arXiv:astro-ph/9911257v1 15 Nov 1999

ISO-SWS observations of Jupiter: measurement of the ammonia tropospheric profile and of the 15N/^{14}N isotopic ratio

Thierry Fouchet^1, Emmanuel Lellouch^1, Bruno Bézard^1, Thérèse Encrenaz^1, Pierre Drossart^1, Helmut Feuchtgruber^2 and Thijs de Graauw^3

1DESPA, Observatoire de Paris, 5 Place Jules Janssen, 92195 Meudon Cedex, France tel.: 33.1.45.07.76.60 fax : 33.1.45.07.71.10 email : Thierry.Fouchet@obspm.fr

2Max-Planck-Institut für Extraterrestrische Physik, 85748 Garching, Germany

3SRON, PO box 800, 9700 AV Groningen, The Netherlands

57 pages 2 tables 15 figures

Proposed running title: Ammonia in Jupiter from ISO-SWS observations

Send correspondence to: Thierry Fouchet, Observatoire de Paris, DESPA-T1m, 5 Place Jules Janssen, 92195 Meudon Cedex, France; tel.: 33.1.45.07.76.60; fax: 33.1.45.07.71.10; email: Thierry.Fouchet@obspm.fr

Abstract

We present the results of the Infrared Space Observatory Short Wavelength Spectrometer (ISO-SWS) observations of Jupiter related to ammonia. We focus on two spectral regions; the first one (the 10-μm region), ranging from 9.5 to 11.5 μm, probes atmospheric levels between 1 and 0.2 bar, while the second one (the 5-μm window), ranging from 4.8 to 5.5 μm, sounds the atmosphere between 8 and 2 bars. The two spectral windows cannot be fitted with the same ammonia vertical distribution. From the 10-μm region we infer an ammonia distribution of about half the saturation profile above the 1-bar level, where the N/H ratio is roughly solar. A totally different picture is derived from the 5-μm window, where we determine an upper limit of 3.7 × 10^{−5} at 1 bar and find an increasing NH_3 abundance at least down to 4 bar. This profile is similar to the one measured by the Galileo probe (Folkner et al. 1998). The discrepancy between the two spectral regions most likely arises from the spatial heterogeneity of Jupiter, the 5-μm window sounding dry areas unveiled by a locally thin cloud cover (the 5-μm hot spots), and the 10-μm region probing the mean jovian atmosphere above 1 bar. The^{15}NH_3 mixing ratio is measured around 400 mbar from ν_2 band absorptions in the 10-μm region. We find the atmosphere of Jupiter highly depleted in^{15}N at this pressure level ((^{15}N/^{14}N)_J = (1.9^{+0.9}_{−1.0}) × 10^{−3}, while (^{15}N/^{14}N)_⊕ = 3.68 × 10^{−3}). It is not clear whether this depletion reveals the global jovian^{15}N/^{14}N ratio. Instead an isotopic fractionation process, taking place during the ammonia cloud condensation, is indicated as a possible mechanism. A fractionation coefficient α higher than 1.08 would explain the observed isotopic ratio, but the lack of laboratory data does not allow us to decide unambiguously on the origin of the observed low^{15}N/^{14}N ratio.

Key words: Atmospheres, Composition; Infrared Observations; Jupiter, Atmosphere

1 Introduction

Ammonia plays an important role in understanding the jovian atmosphere in three main areas. First, its bulk abundance is an indicator of the source of planetesimals which have enriched Jupiter’s atmosphere in C, S, N and presumably O (C/H = 2.9 × solar, S/H = 2.5 × solar (Niemann et al. 1998)). As discussed by Owen et al. (1997) a jovian C/N ratio larger than solar would indicate that such planetesimals formed at too warm a temperature to trap N_2 in their ices, as it is the case for the comets (Eberhardt 1998). This picture is consistent with the deep NH_3 mixing ratio deduced by Bjoraker et al. (1986), de Pater (1986) and Joiner and Steffes (1991), approximately 2.5 × 10^{−4} (1.1 × solar, assuming the solar N/H of Anders and Grevesse (1989)), but is challenged by Lellouch et al. (1989) and Carlson et al. (1993) who inferred a deep value of 4.5×10^{−4} (2.0 × solar), and more recently by the Galileo probe which measured (4 ± 0.5) × solar at 8 bars (Folkner et al. 1998).

Secondly, the^{15}N/^{14}N isotopic ratio in the jovian atmosphere is thought to indicate the primitive^{15}N/^{14}N ratio in the pre-solar nebula. Since the measurement of the 15N/^{14}N ratio in the solar wind exhibits large variations, ([−21%, +12%]), with respect to the terrestrial^{15}N/^{14}N (Geiss and Bochsler, 1982), Jupiter is the best suited object to determine this important parameter for models of the solar system formation. However, an accurate determination of the^{15}N/^{14}N ratio from the 10-μm region has proved to be difficult. Encrenaz et al. (1978) and Tokunaga et al. (1980) deduced a value in agreement with the terrestrial ratio, but with uncertainties of a factor of 2.

Finally, as a condensable species, ammonia is a major tracer of the dynamical and meteorological state of the planet. Indeed, at several bars, ammonia may first dissolve in liquid water, then it reacts with H_2S to form an NH_4SH cloud at 2 bars, condenses to form the NH_3-ice cloud around 0.6 bar and is finally photodissociated in the upper troposphere. In agreement with this model, the gaseous ammonia mixing ratio is found to sharply decrease with altitude above the 0.6-bar pressure level (Kunde et al. 1982; de Pater 1986), while analysis of the Voyager/IRIS spectra (Carlson et al. 1993) and of ground based centimetric observations (de Pater, 1986) suggested a constant mixing abundance at pressures deeper than 2 bars. However, new insights came from the Galileo probe, since the ammonia mixing ratio at entry point was observed to increase down to 8 bars and to remain roughly constant at deeper levels (Folkner et al. 1998).

The uncertainties and the discrepancies between the above studies clearly show that our knowledge of ammonia has not yet settled on a unique picture. The Short Wavelength Spectrometer on board the Infrared Space Observatory (ISO-SWS) offered a unique opportunity for a simultaneous coverage of Jupiter’s spectrum from 2.4 to 16 μm at an average resolution of 1200. Here we present the analysis of the ISO-SWS data regarding ammonia. We use two spectral regions, the 5-μm window and the 10-μm region, to infer the ammonia vertical distribution from 8 to 0.2 bar. In addition, the spectral resolution of the measurements is sufficient to determine the^{15}N/^{14}N isotopic ratio. The observations are presented in Section 2. Section 3 describes the atmospheric model used to analyze the spectrum. From the comparison of ISO-SWS data and synthetic spectra, we infer the NH_3 vertical profile and the^{15}N/^{14}N ratio. Finally, the results are discussed in Section 4.

2 Observations

Descriptions of the ISO satellite and of the SWS can be found respectively in Kessler et al. (1996) and de Graauw et al. (1996). ISO-SWS grating observations of Jupiter were obtained on December 6th, 1996 and May 23rd, 1997 using respectively the AOT 06 and AOT 01 modes of SWS. The AOT 06 observations are at a slightly higher resolution, but analysis of the two spectra leads to the same conclusions. Therefore this paper will be based on the interpretation of the AOT 01 spectrum. The entire spectral region from 2.4 to 45 μm was observed, but saturation effects due to the very high flux of Jupiter limited the useful range to 2.4–16 μm. The exposure time was 110 minutes and the resolving power ranges from 800 to 1500. The aperture, 14 × 20 arcsec^2 at λ < 12.5 μm and 14 × 27 arcsec^2 at λ > 12.5 μm, was centered on the planet with the long axis aligned perpendicular to the ecliptic, thus roughly parallel to the N-S polar axis. The sub-earth latitude was 0.07^∘, the field of view thus covering latitudes between −30^∘ and 30^∘. The average airmass over the regions of jovian disk encompassed by the aperture is 1.08. The SWS flux and wavelength calibration are described in Schaeidt et al. (1996) and Valentijn et al. (1996). The accuracy of the absolute flux scale is approximately 20%.

3 Radiative transfer analysis

We have interpreted the data with a line-by-line radiative transfer code. Our model included the rovibrational bands from CH_4, NH_3, PH_3, GeH_4, H_2O, AsH_3 and CH_3D. The parameters used in the modeling for these different gases —i.e. the mole fractions, the line positions, the strengths and lower energies, and the H_2 and He broadening coefficients— are listed in Table I. The line profiles were assumed to be Voigt-shaped (i.e. essentially Lorentz-shaped at the sounded pressures). To account for the expected sub-lorentzian behavior of the far wings, we applied a cutoff at 20 cm^{−1}. The collisioninduced absorption of H_2–H_2 and H_2–He is also an important source of opacity. It was included in our calculation, using the theoretical works of Borysow et al. (1985, 1988). Cloud layers, needed to fit the observed continuum level, were introduced with adjustable pressure levels, transmissions and scale heights, but our radiative transfer code does not explicitly take into account scattering effects. However, we have estimated the modifications to the retrieved gaseous abundances induced by multiple scattering, as described in Section 3.1.2.

The 5-μm and 10-μm measurements sound Jupiter’s troposphere. Therefore, a tropospheric temperature profile is needed for interpreting the observations. It is usually retrieved using the S(0) and S(1) H_2-lines (Gautier et al., 1981). However, because of the saturation of the ISO-SWS spectrum longward of 16 μm, we used the temperature profile measured in-situ by the Galileo probe (Seiff et al. 1998), which we slightly modified in the upper troposphere. Indeed, the Galileo probe entered a peculiar region of Jupiter’s atmosphere —the edge of a 5-μm hot spot— which is not representative of the large area covered by the ISO-SWS aperture. This is consistent with the fact that the brightness temperature of 115.7 K, as calculated in the H_2–He continuum at 602 cm^{−1} for the Galileo temperature profile, is slightly colder than the average 117.5 K observed by Voyager/IRIS at this wavenumber, between −30^∘ and +30^∘ latitude (Hanel et al.

1979). To account for this, the Galileo temperature profile was smoothed over one scale height to erase local oscillations, then warmed by 2 K at 150 mbar and smoothly reconnected to the original Galileo profile at 30 and 500 mbar. In the lower troposphere, below 500 mbar, the temperature field is expected to be homogenized by convection, and we adopted there the Galileo probe measurements. While spatial variations do occur in the lower stratosphere, the choice of the temperature profile in that region is not critical for the results for ammonia, because of the strong depletion due to NH_3 condensation and photodissociation in this region.

3.1 NH_3 vertical distribution 3.1.1 Upper troposphere: 10-μm region

The 10-μm region is dominated by the absorptions of the ν_2 band of ammonia, leaving the retrieval of the ammonia vertical profile free of contamination from other gases. Figure 1 displays the contribution functions in the Q-branch center at 10.73 μm and in a line center at 10.83 μm, as well as in the pseudo-continuum at 10.91 μm between NH_3 lines. The widths of the contribution functions show that three independent points on the NH_3 vertical profile can be inferred at 300, 410 and 630 mbar. At pressures less than 300 mbar and larger than 630 mbar the NH_3 mixing ratio was extrapolated with the same slope as the one between, respectively, 300 and 410 mbar, and 410 and 630 mbar. At pressures less than 200 mbar the ammonia mixing ratio has only a marginal influence on the calculated spectra. As NH_3 is removed by photodissociation in the upper troposphere, we cut it off at this pressure level. Below 900 mbar, following our results of Section 3.1.2, the distribution was held vertically constant as soon as it reached the value of 3.5 × 10^{−4} (1.6 × solar).

The cloud layer around 700 mbar also contributes to the atmospheric opacity, making the retrieved ammonia abundance at 630 mbar sensitive to the cloud transmission. Therefore we included this layer in our model. We assumed that the cloud layer is composed of NH_3-ice particles, as expected from thermochemical models and indicated by the ISO-SWS spectrum at 2.9 μm (Brooke et al., 1998). The cloud transmission was spectrally calculated as T_c = exp(−K.Q_{abs}) where Q_{abs}, the particle absorption cross section, was calculated from Mie theory for NH_3-ice spheres, using optical constants measured by Schmitt et al. (1998). The factor K was adjusted to obtain the correct flux at 11.08 μm. Following Brooke et al. (1998), we first used a particle radius of 10 μm. Following Conrath and Gierasch (1986), we used a particle scale height (H_p) equal to 0.15 times the atmospheric scale height (H_p = 0.15 × H_g). The result of the synthetic calculation is compared with the ISO-SWS spectrum in Fig. 2a (dashed line). Clearly, ammonia ice particles of this size give too much absorption in the ammonia ice band centered at 9.5 μm(see mismatches at 9.62 and 9.82 μm). Our crude modeling may not exactly estimate the transmission of a scattering ammonia cloud, but similar results were obtained by Marten et al. (1981) with a multiple scattering code. They essentially concluded that the absence of any ammonia ice feature in the Voyager/IRIS spectra implies that the cloud particles at 700 mbar act as grey scatterers. Since the ISO-SWS spectrum is also exempt of such a feature, we reach the same conclusion. Grey scatterers can be obtained for NH_3-ice particle larger than 100 μm (see Fig. 2b). Reasons for the disagreement with Brooke et al. (1998) will be investigated in a future publication. In the rest of this paper, we consider the cloud particles to be grey absorbers at 10 μm.

The cloud transmission was set to the value deduced from Voyager/IRIS observations in the Equatorial Zone by Gierasch et al. (1986), i.e. T_c = 0.8. The results of Gierasch et al. (1986) are found to be compatible with the cloud structure measured by Galileo/SSI (Banfield et al. 1998); since the Voyager/IRIS results are at a larger spatial scale we used them here. The influence of this parameter will be fully explored in Section 3.2. We used a particle scale height (H_p) equal to 0.15 times the atmospheric scale height (H_p = 0.15 × H_g).

The best fit between the observed and synthetic spectra is shown in Fig. 2a (dotted line) for the nominal temperature profile and the atmospheric parameters mentioned above. The corresponding NH_3 profile is shown in Fig. 3 (solid line). While a general match of the observed spectrum is achieved, departures can be seen between the ISO- SWS and synthetic spectra, in the Q-branches and P and R-branches. The flux level in the core of the Q-branches (notably at 10.73 μm) is overestimated by the model, while that in the core of most of the P and R-lines is underestimated (notably at 10.08, 11.01 and 11.27 μm). In addition, the synthetic spectrum is too low in the wings of the Q-branches (10.20 and 10.90 μm), and too high in the continuum between the P and R lines (10.0 and 11.1 μm for example). These systematic discrepancies were already observed by previous authors (Griffith et al. 1992) and their origin remains unclear. They could be due to a limitation of spectroscopic data or to uncertainties in the real lineshape of the far wings which could possibly significantly differ from the assumed sub-lorentzian profile. This error limits the accuracy of our retrieved NH_3 abundance to

+36% −45% at 300 mbar and

+50% −32% at 630 mbar. Other mismatches between the synthetic and

observed spectra occur at 9.60, 9.79, 9.97, 10.60, 11.07 and 11.31 μm. They are related to the^{15}N/^{14}N isotopic ratio, and will be fully analyzed in Section 3.2.

Uncertainties in the temperature profile also induce important uncertainties on the vertical ammonia distribution. We have allowed the temperature profile to vary between ±2 K of the nominal temperature profile. This variation is derived from the Voyager/IRIS brightness temperature map of Jupiter at 602 cm^{−1} (Hanel et al. 1979), where departures of ±2 K of the brightness temperature are observed around a mean value of 117.5 K. Such a variation is certainly conservative for pressure levels deeper than 500 mbar. This uncertainty in the temperature profile induces an error of a factor of 2–3 on the NH_3 profile (Fig. 3). However, qualitatively, the ammonia profile remains unchanged. It always exhibits a subsaturated region between ∼ 1 bar and 400 mbar, and then decreases rapidly with altitude at pressures less than 400 mbar, with a NH_3 mixing ratio scale height of H_q = 0.085 × H_g.

3.1.2 Lower troposphere: 5-μm window

The 5-μm window allows the retrieval of the ammonia vertical profile between 2 and 7 bar. However, overlapping absorptions of H_2O, PH_3, and of the entire cloud system make this determination more complicated than in the 10-μm region. This is illustrated in Fig. 4, where the respective contributions of NH_3 and H_2O are displayed. It can be seen that the H_2O absorptions dominate at λ < 5.2 μm, whereas NH_3 absorptions prevail at λ > 5.2 μm. The prominent lines at 4.84, 4.90, 4.96, 5.02, 5.08, 5.15 and 5.21 μm (Fig. 4a) are water absorptions. They enable us to determine two points (Fig. 4b) on the water vertical distribution at 5.9 bar (4.84 μm) and 3.8 bar (5.21 μm), although the 5.9-bars point suffers from some limited contamination by other gases. Absorption of ammonia dominates from 5.3 to 5.5 μm, and exhibits two strong spectral features at 5.16 and 5.20 μm (Fig. 4c). The contribution functions (Fig. 4d) show that these absorptions probe the NH_3 vertical profile down to 4 bar. At wavelengths shortward of 5 μm the flux originates from even deeper levels, but in this region the NH_3 lines are strongly blended with the H_2O and PH_3 lines. Large uncertainties will thus result in the determination of the deep ammonia mixing ratio.

Direct retrieval of the cloud properties from the observed spectrum is very difficult in the 5-μm window, since the cloud particles act as grey absorbers and scatterers (Carlson et al. 1994). Previous authors (Bézard et al. 1983; Bjoraker et al. 1986; Lellouch et al. 1989; Roos-Serote et al. 1998) found that the effect of clouds can be modeled phenomenologically by using a purely transmitting cloud in the 1.5–2.0 bar range. We adopted this approach with the following modeling strategy: we assumed a cloud model (i.e. a cloud base pressure and scale height); for this model, we determined, through an iterative process, the cloud transmission and the vertical distributions of both water and ammonia. The overall quality of the associated fit in turn validated our assumptions on the cloud model. In addition, reflection of solar radiation on the NH_3 cloud was accounted for by introducing a low albedo (0.03) reflecting cloud at 0.55 bar. This albedo was found necessary to fit the 4.3-μm region (Encrenaz et al. 1996).

Scattering models indicate that optical thickness for the putative NH_4SH and H_2O cloud layers may be large (Carlson et al., 1994). In this case, neglecting multiple scattering may be a poor approximation. However, we show below that accounting for multiple scattering would not change qualitatively our results. Spatially homogeneous model

We first calculated the synthetic spectrum for an infinitely thin (H_p = 0) cloud located at 1.5 bar (∼ 190 K). This cloud model is meant to represent planet-average conditions. The water vertical distribution inferred in this case corresponds to 1.5% of saturation, a result similar to that obtained by Roos-Serote et al. (1998) who analyzed Galileo/NIMS hot spot observations. Consistent with the Galileo probe Nephelometer measurements (Ragent et al. 1998) and the analysis of Roos-Serote et al. (1998), we do not need extra opacity at deeper levels as would be expected from the condensation of water at the 5-bar pressure level. The ammonia vertical distribution is constrained to fit the oberved line depths at 5.32 μm (2 bar), 5.20 μm (4.4 bar), and 4.94 μm (7.3 bar), and the cloud transmission needed to fit the continuum level is very low (8%) (Fig. 5, dotted line). Strong disagreements between the observed and the synthetic spectra are evident longward of 5.25 μm, where the predicted flux level is far too strong. We tried to reduce this disagreement by increasing the ammonia mixing ratio, but it strongly increased the NH_3 line depths shortward of 5.20 μm as shown on Fig. 5 (dashed line). It also could not be lowered by varying the water mixing ratio, since water is too weak an absorber in this spectral region. The problem is in fact due to the cloud emission which, with an effective brightness temperature of 188 K, accounts for nearly half of the synthetic flux at wavelenghts greater than 5.25 μm. The data rather indicate that the cloud has an effective brightness temperature lower than 166 K. This can be obtained by different means: raising the altitude of the cloud base, or using a finite cloud scale height, or any combination of the two. Thus, many cloud models are compatible with the ISO-SWS observations of the 5-μm window—from a vertically thin but optically thick layer located at the 1-bar pressure level to a very diffuse cloud located deep in the troposphere. Theoretical models of the cloud chemistry (Atreya 1986; Carlson et al. 1987) predict the condensation of a NH_4SH cloud with a cloud base at 1.9 bar, but such a cloud has not been unambiguously detected either by the Galileo probe or by remote sensing. Therefore, we limited our analysis to two extreme cases: a model with an infinitely thin cloud layer located at 1 bar, and a cloud layer at 1.9 bar with H_p = 0.6 × H_g. In both cases the cloud transmission is T_c = 8% (τ_c = 2.5).

We then attempted to fit the observed spectrum with a vertically uniform ammonia profile. The results of the calculation for a mixing ratio of 1.0 × 10^{−4} are displayed on Fig. 6 and 7 for a cloud base at 1 bar and 1.9 bar, respectively. The NH_3 line at 4.94 μm is not reproduced deep enough by the model, due to a too low ammonia abundance around 7 bar, while on the contrary the modeled 5.32-μm line is too strong, the NH_3 mixing ratio being too high at the 2-bar pressure level. A vertically uniform ammonia profile below the condensation level must thus be rejected in favor of a profile decreasing with altitude. Our best fits are displayed on Fig. 6 and Fig. 7, and the inferred ammonia vertical profile on Fig. 8. In this profile the NH_3 mixing ratio is [NH_3]/[H_2] = 2.8 × 10^{−4}

(N/H = 1.3 × solar) at pressures greater than 4 bars. However, we will show further in this section that this value suffers from large uncertainties. Above the 4-bar level the NH_3 mixing ratio decreases with altitude, leading to a value of 3.7 × 10^{−5} at the 2-bar level.

The retrieved gaseous abundances may be significantly different from the true values, since we have neglected scattering within the cloud layer. However, accounting for multiple scattering is not likely to change our main conclusion of an ammonia vertical distribution increasing with depth. Indeed, light scattering has two major effects on the flux transmitted through the cloud layer. First, the photons are angularly redistributed. This redistribution affects the average flux level of spectrum, but does not change significantly the modeled line-to-continuum ratios because most of the flux originates from atmospheric levels located below the cloud level, and because the extinction cross sections of ice particles are nearly constant for the different cloud types over the whole 5-μm region (see Fig. 7 of Carlson et al. (1994)). Thus, the outgoing flux is equally affected at each wavelength by the angular redistribution, and line-to-continuum ratios are left unchanged.

A second, more important, effect of multiple scattering is to increase the geometrical path of photons within the cloud layer. Therefore, a model that does not account for this effect will tend to overestimate the amount of the molecular absorbers. However, the effect on the retrieved mixing ratios is much more smaller for lines probing below the cloud layer, such as the weak 5.20-μm line, than for lines probing cloud levels, as the strong 5.32-μm line. Thus, accounting for multiple scattering would only strengthen our conclusion of a larger NH_3 mixing ratio at 4 bars than at 2 bars.

We quantitatively estimated this effect by comparison with the results of Carlson et al. (1993) (their Fig. 2). Carlson et al. found that the effect of multiple scattering in the deep cloud layer (H_2O cloud at 4.9 bars) is to decrease the continuum flux at 1980 cm^{−1} by 15%. Using their molecular distributions, we simulated the increase of optical depth due to scattering by multiplying gaseous optical depths in each layer located within the cloud by a factor proportional to the water cloud opacity. The constant of proportionality was adjusted to reproduce the 15% decrease at 1980 cm^{−1}. As seen in Fig. 9, this empirical approach is able to reproduce the major effects obtained by Carlson et al. (1993): the continuum at 2000–2300 cm^{−1}is more affected than at 1800–2000 cm^{−1}; the flux in the water and ammonia lines is only slightly reduced by multiple scattering.

We then applied this approach to the ISO-SWS data, keeping the same relation between the increase of optical thickness and the cloud opacity. To recover a good fit of the data, we had to reduce the NH_3 mixing ratio from their initial values by a few tens of percents at 2 bars and only by a few percents at 4 bars. As this approach remains empirical, and for internal consistency, we do not regard these modified mixing ratios as definitive estimates. But we strongly feel that a vertically inhomogeneous NH_3 profile is supported by the data.

The 5-μm observations do not constrain the ammonia abundance at pressures less than 2 bars, but a vertically uniform extrapolation of the retrieved mixing ratio at 2 bar gives an upper limit of 3.7 × 10^{−5} at 1 bar. This is in striking contradiction with our analysis of the 10-μm region (Fig. 3), where the NH_3 distribution was found to reach a solar abundance around 1 bar. We think that this discrepancy highlights the spatial heterogeneity of Jupiter’s atmosphere.

Indeed, in the above modeling, the region seen by the SWS aperture (14 × 20 arcsec^2) was assumed to be homogeneous, although this region, from 30^∘ N to 30^∘ S, encompasses the NTrZ (North Tropical Zone), the NEB (North Equatorial Belt), the EqZ (Equatorial Zone), the SEB (South Equatorial Belt) and the STrZ (South Tropical Zone). Differences between belts and zones have long been recognized, especially at 5 μm, where the NEB exhibits very large spatial contrasts, with notable bright regions, the so-called 5-μm hot spots (Terrile et al. 1979), dominating the overall 5-μm flux. The high flux in the hot spots is attributed to a low opacity of the cloud cover. Carlson et al. (1994) calculated the cloud optical depth to vary from 0.04 in the NEB hot spots to 6.2 in the NTrZ and 10 in the EqZ, making the NTrZ and the EqZ nearly dark at 5 μm. Comparison of Galileo/NIMS observations obtained on the day and night sides of Jupiter also concluded to a dark EqZ at 5 μm (Drossart et al. 1998). Our preferred NH_3 vertical distribution from the 5-μm data is therefore expected to be characteristic of the hot spot regions of Jupiter, while the one derived from the 10-μm spectral range should represent the average distribution of NH_3 at Jupiter’s low latitudes.

Spatially heterogeneous model

To validate this hypothesis we constructed a model of Jupiter’s atmosphere which includes two distinct regions. The first one, meant to represent the cloud-covered part of Jupiter, has a cloud optical depth of 6.2 (transmission of 0.2%). This cloud optical depth, arbitrarily chosen to model an optically very thick cloud cover, cannot be directly compared with the value of Carlson et al. (1994) who accounted for scattering within the cloud. The cloud effective brightness temperature must still be limited to 166 K, which, as stated above, can be obtained with various cloud models. Possible solutions are a infinitely thin cloud at 1.0 bar or a cloud base at 1.9 bar and a vertical scale height H_p = 0.40 × H_g. To be consistent with our analysis of Section 3.1.1 we use, for this region, the ammonia vertical distribution derived from the ISO-SWS observations at 10 μm (Fig. 3). The second region, meant to represent the hot spots, is cloud-free. Its surface covering factor (6.5%) in the SWS aperture and its ammonia and water vertical distributions are adjusted to fit the 5-μm observations. This surface covering factor is lower than the needed cloud transmission in the previous spatially homogeneous model (T_c = 8%, τ_c = 2.5), since the effective cloud transmission must be calculated for an average airmass of 1.08, decreasing the cloud transmission to an effective value of T_{c eff} = 6.5% (τ_{c eff} = 1.08 × τ_c = 2.7 ⇒ T_{c eff} = 6.5%). The result of this modeling is displayed on Fig. 10.

The derived ammonia profile in this second region (Fig. 8, dotted line) is similar to the profile determined in the spatially homogeneous model. The ammonia mixing ratio is constant ([NH_3]/[H_2] = 3.5 × 10^{−4}, N/H = 1.6 × solar) at pressures greater than 4 bars, then it decreases with altitude at least up to the 2-bar level where the retrieved ammonia abundance is 2.7 × 10^{−5}. Due to the very low transmission in the cloudy region, nearly all the flux emerges from the hot spots, except in the strongest lines of NH_3 at 5.32, 5.42, 5.46 and 5.49 μm, leaving the synthetic spectrum almost unchanged by Jupiter’s heterogeneity. Disagreements between the observed and synthetic spectra exist at some specific wavelengths (4.86, 5.07 and 5.13 μm). They may result from uncertainties on the strengths of some few NH_3 and PH_3 lines, and consequently they notably affect the uncertainties on the retrieved ammonia mixing ratio at pressures greater than 4 bars, a problem discussed below.

This crude modeling in terms of two regions obviously does not reflect the continuous changes of the jovian atmosphere, as revealed for example by the images of Ortiz et al. (1998). However, it demonstrates the need to invoke spatial heterogeneity and the fact that most of the 5-μm spectrum samples the vertical distributions of water and ammonia in the hot spots rather than on the whole planet. The radiance in our model of the hot spot region at 5 μm, ∼3.5 erg s^{−1} cm^{−2} sr^{−1}/cm^{−1}, is found comparable to (and not surprisingly higher than) that observed in natural hot spots, typically ∼1.5 erg s^{−1} cm^{−2} sr^{−1}/cm^{−1}(Carlson et al. 1993; Roos-Serote et al. 1998). In addition, the Nephelometer experiment on the board the Galileo probe indicated extinction optical depth less than 2.

Neglecting scattering is less important in this spatially heterogeneous approach than in the spatially homogeneous. Indeed, essentially no photons are emitted from below the cloud in the dark region. Introducing multiple scattering would then only change the cloud parameters required to make this region dark. The hot spot region was defined as cloud free, making the problem of scattering irrelevent there. Even if cloud optical depths have typical values of ∼ 2 in hot spots, the number of scattering events is low, and therefore the mean optical path only sligthly increased. Our retrieved ammonia abundances should then be reduced only by a few percents, leaving the ammonia vertical profile nearly unchanged.

It is especially interesting to use our composite model to compare the ISO-SWS data with the Galileo probe measurements. The probe entered a hot spot, where it found a dry atmosphere. Two different experiments on board the probe have measured the ammonia vertical distribution. Folkner et al. (1998) analyzed the attenuation of the probe radio signal. They found the NH_3 mixing ratio to increase with depth from highly depleted at 0.4 bar to 3.2 × 10^{−4} at the 4-bar level and 9 × 10^{−4} (4 × solar) at 8 bars, then roughly constant at deeper levels. Sromovsky et al. (1998), using the Net Flux Radiometer, found a similar profile down to 4 bar, hence increasing with depth, but vertically constant at greater pressures at a mixing ratio of 2.8 × 10^{−4} (1.3 × solar). These profiles are very similar to the one we derived from the ISO-SWS observations (Fig. 8). Therefore we tested the respective profiles of Sromovsky et al. (1998) and of Folkner et al. (1998) against the ISO-SWS data themselves (Fig. 10). To do so, since the mixing ratio derived by Folkner et al. (1998) at 1.5 bar suffers from huge uncertainties, we modified this measurement within the given error bars, in order to get a good agreement with the observed spectrum at 5.3 μm.

The differences induced by the two profiles in the calculations are only marginal. The NH_3 spectral features (4.82, 4.92 and 4.94 μm) calculated for the Folkner et al. profile appear slightly deeper than in the observed spectrum. Yet, these lines lie in the neighborhood of phosphine or water absorptions, thus lowering the sensitivity to the NH_3 mixing ratio. Moreover, mismatches between the observed and the synthetic spectra, already mentioned previously, exist at some other wavelengths (4.86, 5.07 and 5.13 μm for example). The line at 5.07 μm in particular is purely due to phosphine, suggesting that our PH_3 mixing ratio is overestimated. However, reducing it degrades the fit in the center of the phosphine band at 4.8 μm. We leave this problem of the PH_3 mixing profile to future work, where constraints from the entire 4.4–4.8 μm range will also be considered. The disagreements noted above are larger than the differences between the calculated spectra for the Sromovsky et al. and Folkner et al. profiles. Taking all of these sources of error leads to an estimation of the NH_3 mixing ratio of (3.5^{+5.5}_{−1.3}) × 10^{−4} at 7 bars. An accurate determination of the deep ammonia abundance would therefore require a higher spectral resolution, in order to isolate the NH_3 lines, and a better accuracy of the spectroscopic data. In summary, we find that the ISO-SWS and the Galileo probe data are consistent with each other down to the 4-bar level, but that the error bar affecting the deep NH_3 mixing ratio from the ISO-SWS data is too large to discriminate between the two Galileo profiles.

Absence of H_2O cloud

Thermodynamical equilibrium models of Jupiter’s atmosphere predict the presence of a water cloud around 5 bars (Carlson et al. 1987). Such a cloud was invoked by Carlson et al. (1993) from Voyager/IRIS data. But its detection was not confirmed by the

Galileo mission, either from Probe data (Sromovsky et al. 1998; Ragent et al. 1998), or from remote sensing observations with the Near-Infrared Mapping Spectrometer (Roos- Serote et al. 1998). Moreover, Roos-Serote et al. (1999) suggested that the contradiction between the Voyager/IRIS and Galileo/NIMS analyses might be a consequence of a calibration problem affecting the Voyager/IRIS data at wavelengths shorter than 5 μm. We now show that a thick water cloud is also inconsistent with the ISO/SWS data. Here, however, the argument is based on the spectral region longward of 5.3 μm, a region which was not observed by Galileo/NIMS and which suffered from too low a signal-to-noise ratio in Voyager/IRIS data to be usable. Figure 12 displays the synthetic spectrum computed with our composite model in the presence of a thick deep cloud. The region with the 1.0–1.9 bar cloud is unchanged (anyway it is not sensitive to the presence of a deep H_2O cloud), while a cloud layer based at 5 bars is introduced in the hot spot region. Its transmission is arbitrarily fixed to T_c = 0.5 and its scale height to H_p = 0.20 × H_g (Carlson et al. 1993). All other parameters being fixed, both the continuum level and the H_2O line depths are lowered by the presence of the H_2O cloud. Thus the surface covering factor of the hot spot region (13%) is adjusted to fit the data at 5.05 μm, and the water mixing ratio is increased to 8% of saturation, in order to recover the observed contrast in the water lines. This model leads to a strong disagreement with the observed spectrum longward of 5.2 μm. The reason for this behavior is the following: the water cloud opacity essentially affects the center of the 5-μm window, where half of the flux originates from levels deeper than 5 bars. On the contrary, in the edges of the window, the thermal emission mainly comes from pressure levels lying between 2 and 5 bars, thus unaffected by the water cloud. As a result the flux around 5.3 μm is enhanced with respect to the center the 5-μm window and, for a 13% surface covering factor of the hot spots, is inconsistent with the observations. This excess emission cannot be reduced in any way. The cloud emission, which now contributes only at a level of 10% to the calculated flux, cannot be tuned to reduce the excess emission. We also tested the effect of the cutoff to the Lorentz profile (20 cm^{−1}), applied to describe the sub-Lorentzian lineshapes. We found that it does not significantly affect the synthetic spectrum. Therefore we must reject the presence of an opaque cloud around 5 bars, at least in the hot spots, in agreement with Galileo observations (Sromovsky et al. 1998; Ragent et al. 1998; Roos-Serote et al. 1998, 1999).

3.2^{15}N/^{14}N isotopic ratio

In the computation of the synthetic spectrum displayed on Fig. 2 we assumed a terrestrial value for the^{15}N/^{14}N isotopic ratio ((^{15}N/^{14}N)_⊕ = 3.68 × 10^{−3}). But, investigating the^{15}NH_3 absorptions at 9.60, 9.79, 9.97, 10.60, 11.07 and 11.31 μm, it appears clearly that the terrestrial isotopic ratio overestimates the abundance of^{15}NH_3 in Jupiter’s atmosphere. As shown on Fig. 13, a^{15}NH_3 depletion of δ = −50% is in good agreement with the ISO-SWS observations, where

δ = 100 × [

(^{15}N/^{14}N)_J (^{15}N/^{14}N)_⊕ − 1].

This is at face value a very surprising result; however many parameters affect the retrieved^{15}N/^{14}N value, leading to large uncertainties. The^{15}NH_3 lines probe the 15NH_3 mixing ratio at a given pressure (∼ 400 mbar). The deduced^{15}N/^{14}N thus depends on the^{14}NH_3 mixing ratio at the same pressure level. Therefore, in order to evaluate the range of the possible^{15}N/^{14}N ratios, we must first take into account all the parameters which can modify the retrieved^{14}NH_3 and^{15}NH_3 mixing ratios, and second simultaneously determine the^{14}NH_3 and^{15}NH_3 mixing ratios at similar pressure levels. To meet this last point, the most suitable way is to simultaneously analyze a 14NH_3 line and a^{15}NH_3 line of similar intensities, formed on the same continuum level. Therefore, in the following analysis, we will compare the weak line of the Q branch of the ν^s_2 band of^{14}NH_3, located at 10.88 μm, with the^{15}NH_3 line at 11.07 μm.

The^{14}NH_3 line has an intensity at 296 K of 4.09×10^{−20} cm molecule^{−1} and an energy level of 721.134 cm^{−1}. The line of^{15}NH_3 is in fact a triplet with respective intensities of 2.48×10^{−22}, 3.90×10^{−22} and 8.62×10^{−22} cm molecule^{−1} at 296 K for a terrestrial isotopic ratio, and energy levels of 104.894, 115.104 and 118.837 cm^{−1}. At 132 K, the temperature at 400 mbar, the^{15}NH_3 triplet is thus intrinsically 1.4 times stronger than the^{14}NH_3 line (the relative accuracy in intensity between lines of this strength is expected to be better than 10%, including the uncertainties on the terrestrial^{15}N/^{14}N). Yet, Fig. 14 shows that the line at 10.88 μm is observed to be deeper than the^{15}NH_3 triplet. Furthermore, the two lines lie on the same continuum level, which can be fitted simultaneously with the same NH_3 distribution and cloud transmission (Fig. 13). Therefore we think that the observed relative depths of the^{15}NH_3 and^{14}NH_3 absorptions can only be explained by a significant depletion in^{15}NH_3 with respect to the terrestrial ratio.

We have tested the robustness of this conclusion and derived a^{15}N/^{14}N range by varying all model parameters which can affect the retrieved^{14}NH_3 and^{15}NH_3 mixing ratio profiles. These parameters are the following:

• The transmission of the cloud layer is subject to uncertainties which can change the inferred ammonia abundance: for a lower cloud transmission the continuum level is increased while the strongest NH_3 lines remain unaffected. Thus a lower ammonia mixing ratio is needed below 400 mbar. We take this effect into account by allowing the cloud transmission to vary between 0.6 and 1.0 by step of 0.1. Transmissions lower than 0.6 are unrealistic and rejected, following the analyses of Gierasch et al. (1986) and Griffith et al. (1992).

• The precise shape of the far wings of the NH_3 lines is not very well known, and a significant departure from the Lorentz profile is possible. The effect on the ammonia mixing ratio is that a sublorentzian profile requires, to reproduce the observed continuum, a larger^{14}NH_3 content than a Lorentz profile. We take into account this effect by calculating the^{15}N/^{14}N for four different line shapes. Two of them are Lorentz profiles with cutoffs at 20 and 50 cm^{−1} respectively, while the other two, following results obtained by Burch et al. (1969) on the CO_2 molecule, are Lorentz profiles multiplied respectively by shape factors χ(ν) = e^{−(ν−ν0)/80} and χ(ν) = e^{−(ν−ν0)/30}, where ν − ν_0 is the offset from the line center in cm^{−1}.

• The temperature profile is the parameter which produces the most important variations in the ammonia mixing ratio. Following our analysis of Section 3.1.1, we allowed it to vary among three possible profiles: the nominal one, a warmer one (+2 K) and a colder one (−2 K).

For each combination of the three temperature profiles, of the four line shape factors and of the five different cloud transmissions, we retrieved the ammonia vertical profile which fits the 10.88-μm line and the surrounding continuum (i.e. 60 different profiles). We then determined the^{15}NH_3 mixing ratio which best fits the 11.07-μm line. The results are summarized in Table II. The influence of the cloud transmission and of the ammonia line shape factor on the^{15}N/^{14}N is relatively weak. The reason is that variations of these two parameters mainly lead to variations of the ammonia mixing ratio at 630 mbar but only slightly at 400 mbar, the level probed by the^{15}NH_3 lines. The change in the temperature profile alters the retrieved^{15}N/^{14}N ratio more significantly.

However, none of the inferred values for the^{15}N/^{14}N ratio is in agreement with the terrestrial value. A terrestrial value could be obtained only for a temperature profile 8 K colder than the nominal profile, leading to a temperature as low as 100 K at the tropopause. Such a situation is very unlikely and, moreover, leads to a totally unacceptable fit of the whole 10-μm region (Fig. 15). We therefore conclude from the analysis of the 10.07-μm line that the^{15}N/^{14}N at 400 mbar is subterrestrial with a value of δ = (−50^{+25}_{−25})%. This result is qualitatively confirmed by the other^{15}NH_3 lines (Fig. 13).

4 Discussion

4.1 Ammonia vertical profile

We find an ammonia mixing ratio at the 300 mbar level of 3.2 × 10^{−7}. This value is lower than the one inferred from the Voyager/IRIS observations by Kunde et al. (1982) (1.4 × 10^{−6} in the NEB), and by Griffith et al. (1992) (1.4 × 10^{−6} in the STrZ). On the contrary, Carlson et al. (1993), also from Voyager/IRIS data, found in the NEB an ammonia mixing ratio (2.4 × 10^{−7}) similar to the one we deduced. These differences may be partly related to spatial variations, but are more likely the consequence of differences in the model parameters, such as the location of the distribution anchor points, or in the temperature profiles. Lara et al. (1998), from high spectral resolution observations, investigated spatial variations of the ammonia mixing ratio at 240 mbar. They found it to range between 4.8 × 10^{−8} and 1.0 × 10^{−9}, the largest values being clustered at 10^∘S–18^∘S latitude, and the lowest at 30^∘S–35^∘S latitude. Their interpretation of this difference is that the eddy diffusion coefficient (K) is higher at 10^∘S–18^∘S (K ≈ 4000 cm^2 s^{−1}) than at 30^∘S–35^∘S, where they inferred a value of K ≤ 400 cm^2 s^{−1}. Even if our analysis does not probe the same pressure level, we can compare our results with those of Lara et al. (1998), since the calculated eddy coefficient is essentially not determined by the NH_3 mixing ratio at a specific level but rather by the NH_3 mixing ratio scale height (H_q). Inspection of their Fig. 7 shows that at 10^∘S–18^∘S H_q = 0.1 × H_g, while H_q = 0.05 × H_g at 30^∘S–35^∘S. Our inferred value is H_q = 0.085 × H_g. The different anchor points assumed in both studies can greatly affect the retrieved scale height, but this suggests that the high value of the eddy diffusion coefficient (i.e. K ≈ 4000 cm^2 s^{−1}) represents the average situation over Jupiter’s low latitude. As already noted by Lara et al. (1998) this finding must be linked with the global pattern of the ortho-para hydrogen ratio (Conrath and Gierasch 1984), which exhibits a departure from the equilibrium maximum at the equator and decreasing toward the poles. This departure can also result from a stronger eddy coefficient at low latitudes than at the poles (Conrath and Gierasch 1984). However, this result is in contradiction with the work of Edgington et al. (1998). They combined a photochemical model with HST/FOS observations of Jupiter to retrieve the NH_3 mixing ratio and the eddy diffusion coefficient at several latitudes between 6^∘ N and 48^∘ N. They found no latitudinal variations at pressures greater than 170 mbar. Reasons for this disagreement with Lara et al. (1998) are unclear, since the Rayleigh scattering allows the photons to penetrate as deep as the 300-mbar level at 220 nm, and forbid a consistent picture of the photochemical and dynamical processes taking place in the upper troposphere of Jupiter.

At pressures greater than 300 mbar, we find a mixing ratio of 1.8 × 10^{−5} at 450 mbar and 4.2 × 10^{−5} at 600 mbar. This is in satisfactory agreement with previous measurements. Carlson et al. (1993) and Kunde et al. (1982) found respectively 8.8 × 10^{−6} and 8.9 × 10^{−6} at 450 mbar, and 2.8 × 10^{−5} and 3.0 × 10^{−5} at 600 mbar, while Griffith et al. (1992) inferred in the STrZ 1.4 × 10^{−5} at 450 mbar and 3.5 × 10^{−5} at 600 mbar respectively. The values of Carlson et al. (1993) and Kunde et al. (1982) are lower than the value of Griffith et al. (1992) and ours, probably because they specifically probe the NEB, a region of low relative humidity.

In the 5-μm window, we find that a cloud layer is needed to attenuate the flux in agreement with many other earlier studies. This cloud layer must have an effective brightness temperature lower than 166 K. This contradicts the previous analyses from Voyager and KAO spectra (Bézard et al. 1983; Bjoraker et al. 1986; Lellouch et al. 1989) which were limited to the 4.8–5.2 μm range and assumed a cloud effective brightness temperature of ∼190–200 K. A temperature of 166 K can be obtained with various cloud models, from a deep, vertically extended layer to a thin layer located around the 1-bar level. It implies that the 5-μm attenuating cloud could also contribute significantly to the opacity above the 1-bar level. The same conclusion was reached by Drossart et al. (1998) who found, from the coldest Galileo/NIMS spectra on the night side of the planet, a cloud effective brightness temperature of 160 K or lower. In addition, we note that the 5-μm attenuating cloud cannot be unambiguously identified with the expected NH_4SH cloud layer.

From the 5-μm observations we find that the NH_3 mixing ratio increases downward at least down to 4 bars and that a constant mixing ratio below the condensation level can be rejected. Although our simple model does not include scattering, we qualitatively find that multiple scattering can only increase this trend. This ammonia profile is associated with a highly subsaturated water profile. This very dry meteorological situation does not reflect the global state of the planet, but rather pertains to small areas, most probably the 5-μm hot spots. This is strongly supported by the consistency between our inferred ammonia profile and the profiles of Sromovsky et al. (1998) and Folkner et al. (1998) determined from the Galileo probe measurements.

Previous analyses of the 5-μm window have not put in evidence such a vertically variable distribution, and this for various reasons. Bjoraker et al. (1986) and Lellouch et al. (1989) did not focus on the vertical distribution of ammonia. Both of them assumed the distribution to follow the profile derived by Kunde et al. (1982) above 0.7 bar, and to be constant below at a mixing ratio determined from a best fit to their observations. The spatial variations of the deep NH_3 abundance found by Lellouch et al. (1989) thus mostly reflect the variations of the average ammonia mixing ratio near the 2-bar level. On the other hand, from a reanalysis of the Voyager/IRIS data, Carlson et al. (1993) found an increasing ammonia abundance down to 2 bars and constant at deeper levels in the NEB. We think that this is not in contradiction with our results since the IRIS resolution (4.3 cm^{−1}), approximately 3 times lower than that of SWS (∼ 1.3 cm^{−1}), did not allow to resolve the NH_3 lines shortward of 5.3 μm which probe the 4-bar pressure level.

From radio wavelength observations de Pater (1986) found that the ammonia mixing ratio must be constant at pressures greater than 2 bar. Reason for this disagreement with the ISO-SWS observations and the Galileo probe measurements is not clear. Possible explanations are uncertainties on the subtraction of the Jupiter synchrotron radiation or on the ammonia lineshape factors (Moreno 1998).

The global N/H ratio of Jupiter, inferred from the NH_3 mixing ratio at 7 bar suffers, as stated in Section 3.1.2, from very large uncertainties ([NH_3]/[H_2] = (3.5^{+5.5}_{−1.3}) × 10^{−4}, N/H = (1.6^{+2.4}_{−0.6})×solar). This leads to a C/N ratio of (1.8±1.1)×solar. Since the range encompasses the solar value, this does not allow us to confirm or refute the cometary origin of the planetesimals which have enriched Jupiter in heavy elements. However, the agreement between the ammonia profile inferred from the attenuation of the Galileo probe radio signal (Folkner et al. 1998) and the one retrieved from the ISO-SWS data, favors the high N/H (hence low C/N (∼0.7), favoring a non-cometary origin) measured by Folkner et al. (1998), in contradiction with the centimetric observations of de Pater (1986) and Joiner and Steffes (1991).

4.2^{15}N/^{14}N isotopic ratio

The determination of the protosolar^{15}N/^{14}N isotopic ratio is still a debated question, since the Sun and the meteorites exhibit large variations in their isotopic composition of nitrogen. The solar value, measured in the solar wind trapped in the lunar regolith, shows secular variations from -21% to +12% (relative to the terrestrial value of 15N/^{14}N = 3.68 × 10^{−3}) (Geiss and Bochsler, 1982). The^{15}N/^{14}N value in meteorites (reviewed by Pillinger, 1984), varies from -32% to +21%, but the majority of the samples clusters between -3% and +4%. Different scenarios have been proposed to account for these different values. The interpretation of Thiemens and Clayton (1981) yields a protosolar value of -3%, the lighter nitrogen component in meteorites being due to the admixture of an alien^{14}N-rich phase, and the heavier nitrogen to fractionation. Kerridge (1980) proposed that the protosolar value is <-21% and that the^{15}N-enrichment in meteorites and planets is achieved by fractionation. Finally Geiss and Bochsler (1982) proposed a protosolar value of +12%, and that the meteoritic ratios are the result of the admixture of a light nitrogen alien phase.

No definitive argument has yet been advanced to discriminate between the three scenarios, and important issues for the formation of the Solar System, such as the degree and temperature of fractionation in meteorites, or the degree of mixing with interstellar grains, are left unanswered. Therefore Kerridge (1982) had hoped that the Galileo probe could resolve this question. He argued that the greater part of nitrogen in Jupiter should not have suffered isotopic fractionation and that its^{15}N/^{14}N ratio should be regarded as protosolar. Unfortunately, isotopic ammonia has blent with other chemical species in the Galileo probe Mass Spectrometer, thus precluded any reliable measurement of the 15N/^{14}N ratio. Therefore our hopes still rely on remote sensing observations of Jupiter.

Previous determinations of the^{15}N/^{14}N isotopic ratio have been made by Encrenaz et al. (1978) and Tokunaga et al. (1980), who found a^{15}N/^{14}N ratio consistent with the terrestrial value, but within a factor of 2. These results thus largely differ from our measurement of (δ = −50^{+25}_{−25}) %. As we have shown in Section 3.2, an accurate determination of the^{15}N/^{14}N ratio requires an accurate modeling of both^{15}NH_3 and 14NH_3 at the same pressure level. This can only be done using the^{14}NH_3 line at 10.88 μm and the^{15}NH_3 line at 11.07 μm. Tokunaga et al. (1980) measured the full spectrum of Jupiter from 10 to 12 μm, allowing the comparison of the^{15}NH_3 and^{14}NH_3 lines. Investigation of their Fig. 2, where the signal to noise ratio is the highest, shows that the brightness temperatures at 10.88 and 11.07 μm are almost identical (135 K). This agrees with the ISO-SWS data, but it is in contradiction with a terrestrial^{15}N/^{14}N ratio (Section 3.2). We are thus inclined to conclude that the spectrum of Tokunaga et al. (1980) also favors a depletion in^{15}NH_3. Even though they focussed their analysis on 14NH_3 and PH_3, Lara et al. (1998) also observed the^{15}NH_3 line at 943 cm^{−1} (10.60 μm). Inspection of their Fig. 8 shows that the terrestrial value of^{15}N/^{14}N overestimates the depth of the^{15}NH_3 line, the^{14}NH_3 mixing ratio being determined at 380 mbar from the 14NH_3 absorption at 921 cm^{−1} (10.86 μm). The two lines do not exactly lie on the same continuum level, but this nevertheless favors again a depletion in^{15}NH_3.

Hence, even if a systematic problem in the analysis of the ν_2 band of ammonia cannot be totally ruled out, several spectroscopic observations support a depletion of Jupiter in^{15}N. A first hypothesis is that the observed^{15}N/^{14}N depletion reflects the global isotopic ratio (T. Owen, priv. comm.; paper in preparation). This would imply that nitrogen in Jupiter is not of cometary origin, since comets apparently have a terrestrial 15N/^{14}N (as measured in Hale-Bopp by Jewitt et al. (1997)). This conclusion would agree with the Galileo finding that Jupiter’s C/N is not oversolar. In the case of an origin of nitrogen from the gaseous protosolar nebula, both the Sun and, presumably, the interstellar medium should exhibit a similar^{15}N/^{14}N as Jupiter (T. Owen, priv. comm.). We note, however, that in this case the jovian N/H should be solar, which does not seem to be the case. Reconciling the^{15}N/^{14}N and N/H measurements in Jupiter would in fact imply an origin from planetesimals enriched in^{14}N and depleted in^{15}N/^{14}N compared to the solar value. The nature and fate of these bodies however is essentially speculative at this point.

These difficulties to reconcile the observed^{15}N/^{14}N with the abundance in other solar system objects raise the question whether or not the observed^{15}N/^{14}N ratio is representative of the bulk composition of the planet. Indeed we measured the^{15}NH_3 mixing ratio at a pressure level (∼ 400 mbar) where ammonia experiences condensation in NH_3-ice particles and photodissociation from the solar UV radiation, two processes which can plausibly alter the^{15}N/^{14}N ratio.

The photodissociation of ammonia is dominated by the Ã–X̃ band system at 200 nm (Atreya 1986), the unit optical depth being reached at ∼200 mbar in the strongest bands. Since^{15}N/^{14}N ratio is at most 5 × 10^{−3}, the^{15}NH_3 band system could remain optically thin at pressures higher than that of^{14}NH_3, the photodissociation of^{15}NH_3 hence taking place below the^{14}NH_3 photodissociation level. This process could alter the^{15}N/^{14}N at 400 mbar. However, it requires the^{14}NH_3 Ã–X̃ system to be transparent to^{15}NH_3 absorptions. In turn it requires either the^{15}NH_3 and^{14}NH_3 systems to be shifted with respect to each other by a large offset, or the individual rotational lines constituting the bands to be spaced by steps larger than their intrinsic widths. None of these conditions appear to be met (Douglas 1963). The shift between^{15}NH_3 and^{14}NH_3 bands is only ∼30 cm^{−1} (∼1 Å), less than the half-width of each individual band, and the 14NH_3 bands are too diffuse to let photons pass trough their rotational structure. The 15NH_3 photodissociation thus takes place at the same pressure level as that of^{14}NH_3, and is unlikely to produce any significant alteration of the^{15}N/^{14}N ratio at 400 mbar.

Perhaps more promising is the possibility of isotopic enrichment of^{14}N due to condensation. Indeed, it has long been recognized that the vapor pressure of a molecule depends on its isotopic composition, generally leading to an enrichment of the condensed phase in the heavy isotope. Such an isotopic fractionation is widely documented for the condensation of water in the terrestrial atmosphere, where it is known to be an important process. At 0^∘ C the fractionation coefficient α, which measures the enrichment of the liquid phase with respect to the vapour phase at thermodynamical equilibrium, is

1.123 for D and 1.0177 for^{18}O (Majoube, 1971a). The deuterium gradient during the condensation of water can thus be of the order of a few tens of % C^{∘−1} (Jouzel, 1986) and D/H ratios as low as 0.4 × (D/H)_{SMOW} have been measured in the stratosphere (Rinsland et al. 1984) (SMOW stands for Standard Mean Ocean Water).

A similar process can take place on Jupiter during the condensation of gaseous ammonia in NH_3-ice particles. We have calculated the fractionation coefficient α needed to reproduce our observed^{15}N/^{14}N. We used an “open cloud” model, where the condensed phase is assumed to be immediately removed after its formation and to leave the atmospheric parcel in isotopic equilibrium with the vapour phase. This results in a continuous decrease of the heavy isotope content, which is simply written, following Jouzel (1986) by: dδ_V 1 + δ_V

= (α − 1) dn_V n_V , where n_V is the mixing ratio of ammonia and δ_V the enrichment or depletion in^{15}NH_3 of the vapour phase with respect to the terrestrial value. If we assume a constant fractionation coefficient— i.e. independent of the temperature — we can integrate the preceding equation to: δ_V = (1 + δ_0) ( n_V n_0 )_{α−1} − 1, where δ_0 and n_0 are respectively the isotopic content of the vapour phase and the ammonia mixing ratio at the condensation level. We assume δ_0 = 0 (i.e. that the 15N/^{14}N ratio is terrestrial below the cloud), and we solve for α to match the observed δ_V .

The results for various atmospheric models are displayed in Table II. The explanation of the observed^{15}N/^{14}N isotopic ratio by an isotopic fractionation during the cloud condensation requires high fractionation coefficients ([1.08,1.45]). This coefficient has not been measured, as far as we know, for the solid-vapour transition of NH_3, but experiments have been carried for the liquid-vapour transition (Thode, 1940). At 200 K α equals 1.005, well below our lowest value of α = 1.08. Comparisons can also be made with the vapour/solid equilibrium for H_2^{18}O, since the^{15}N and^{18}O atoms play similar central roles in their respective molecules. The fractionation coefficient of H_2^{18}O is also low, α = 1.0152 at 0^∘ C (Majoube, 1971b). In addition, our “open cloud” model most likely underestimates the needed fractionation coefficient since the heavy isotope is constantly removed from the cloud through precipitation.

However, the vapour pressure isotope effect can present a strong temperature dependence. Therefore in the absence of laboratory data for the vapour/solid transition of ammonia at the relevant temperatures, this effect remains a possible explanation of the low observed^{15}N/^{14}N ratio. In addition, the needed fractionation coefficient would be lower if the expected NH_4SH cloud condensation had already reduced the^{15}N/^{14}N ratio priot to NH_3 condensation in an upwelling column of gas.

5 Conclusions

We have analyzed the ISO-SWS spectrum of Jupiter in terms of the ammonia vertical distribution. The observations at 5 and 10 μm cannot be interpreted with a spatially homogeneous atmosphere. At 5 μm, the hot spots, covering 6.5% of the SWS aperture, dominate the overall flux, the rest of the planet being covered by an optically thick cloud layer. At 10 μm, the sounded atmospheric levels are limited to pressures less than 1 bar. The thermal contrast is thus much lower than at 5 μm since the overall flux is dominated by the portion that emerges from the large fraction of the planet that is not within 5-μm hot spots. In this region we find a NH_3 vertical distribution close to solar around 1 bar, then following a subsaturated profile before undergoing depletion by photodissociation above 400 mbar. The hot spots are found very depleted in condensible species. The NH_3 mixing ratio increases with depth at least down to the 4-bar level, well below the condensation level. The ammonia distribution is associated with a low water relative humidity (< 2%). These very dry conditions are similar to those inferred both from the in-situ measurements of the Galileo probe (Folkner et al. 1998; Niemann et al. 1998) and from NIMS data analysis (Roos-Serote et al. 1998).

The measured ammonia mixing ratio at 7 bars ([NH_3]/[H_2] = (3.5^{+5.5}_{−1.3})×10^{−4}, N/H = (1.6^{+2.4}_{−0.6})× solar) suffers from large uncertainties. Yet, the qualitative agreement of the ISO-SWS and Galileo probe ammonia vertical distributions at pressures lower than 4 bars strengthens the high N/H value ((4 ± 0.5) × solar) found by Folkner et al. (1998). Such a value, implying that C/N is not supersolar, points to an origin else than cometary for the planetesimals which have enriched Jupiter in heavy elements.

We find that a thick water cloud around the 5-bar level is not compatible with the ISO-SWS data longward of 5.3 μm. The same conclusion was reached independently by Ragent et al. (1998) using the Nephelometer on board the Galileo probe and by Roos- Serote et al. (1998, 1999) who analyzed the slopes of the NIMS spectra between 4.7 and 5.2 μm.

We find, from the analysis of the ν_2 band of^{15}NH_3 a^{15}N/^{14}N ratio at 400 mbar essentially half of the terrestrial ratio ((^{15}N/^{14}N)_J = (1.9^{+0.9}_{−1.0}) × 10^{−3}, while (^{15}N/^{14}N)_⊕ = 3.68 × 10^{−3}). So far, such a value is unique in the solar system. If it reflects the global jovian^{15}N/^{14}N, it would imply that Jupiter’s nitrogen does not originate from comets. However, an origin from the solar nebula gas may be inconsistent with the N/H observed by the Galileo probe. Alternatively, it could be the consequence of an isotopic fractionation which takes place above the ammonia cloud base. A possible process is the isotopic fractionation occuring during ammonia condensation. We have calculated that the jovian^{15}N/^{14}N could be explained if the condensed phase is enriched in^{15}N at thermodynamical equilibrium by at least a factor of 1.08. This value seems high compared to the other known isotope fractionation coefficients. Nevertheless, in the absence of laboratory data specific to NH_3, we cannot derive any firm conclusions. If this process really occurs on Jupiter, it could be a very important tracer of the cloud microphysics. Laboratory measurements of the fractionation coefficient at the temperatures relevant to the jovian atmosphere would thus be very useful.

Acknowledgements

This study is based on observations with ISO, an ESA project with instruments funded by ESA Member States (especially the principal investigators countries: France, Germany, the Netherlands and the United Kingdom), and with participation of ISAS and NASA. We thank C. A. Griffith, A. Armengaud and D. Gautier for useful discussions.

References

Anders, E., and N. Grevesse 1989. Abundances of the elements: meteoritic and solar. Geochim. Cosmochim. Acta 53, 197–214.

Atreya, S. K. 1986. Atmospheres and ionospheres of the outer planets and their satellites. Springer-Verlag, Berlin.

Banfield, D., P. J. Gierasch, M. Bell, E. Ustinov, A. P. Ingersoll, A. R. Vasavada, R. A. West, and M. J. S. Belton 1998. Jupiter’s Cloud Structure from Galileo Imaging Data. Icarus 135, 230–250.

Bézard, B., J.-P. Baluteau, and A. Marten 1983. Study of the deep cloud structure in the equatorial region of Jupiter from Voyager infrared and visible data. Icarus 54, 434–455.

Birnbaum, G., A. Borysow, and G. S. Orton 1996. Collision-induced absorption of H_2-H_2 and H_2-He in the rotational and fundamentals bands for planetary applications. Icarus 123, 4–22.

Bjoraker, G. L., H. P. Larson, and V. G. Kunde 1986. The gas composition of Jupiter derived from 5-μm airborne spectroscopic observations. Icarus 66, 579–609.

Borysow, J., L. Trafton, L. Frommhold, and G. Birnbaum 1985. Modeling of pressure induced far infrared absorption spectra: molecular hydrogen pairs. Astrophys. J. 296, 644–654.

Borysow, J., L. Frommhold, and G. Birnbaum 1988. Collision induced rototranslational absorption spectra of H_2-He pairs at temperatures from 40 to 3000 K. Astrophys. J. 326, 509–515.

Brooke, T. Y., R. F. Knacke, T. Encrenaz, P. Drossart, D. Crisp, and H. Feuchtgruber 1998. Models of the ISO 3-μm reflection spectrum of Jupiter. Icarus 136, 1–13.

Brown, L. R., and D. B. Peterson 1994. An empirical expression for linewidths of ammonia from far-infrared measurements. J. Mol. Spectrosc. 168, 593–606.

Brown, L. R., and C. Plymate 1996. H_2-broadened H_2^{16}O in 4 infrared bands between 55 and 4045 cm^{−1}. J. Quant. Spectrosc. Radiat. Trans. 56, 263–282.

Burch, D. E., D. A. Gryvnak, R. R. Patty, and C. E. Bartky 1969. Absorption of infrared radiant energy by CO_2 and H_2. IV. Shapes of collision-broadened CO_2 lines. J. Optic. Soc. Americ. 59, 267–280.

Carlson, B. E., M. J. Prather, and W. B. Rossow 1987. Cloud chemistry on Jupiter.

Astrophys. J. 322, 559–572.

Carlson, B. E., A. A. Lacis, and W. B. Rossow 1993. Tropospheric gas composition and cloud structure of the jovian North Equatorial Belt. J. Geophys. Res. 98, 5251–5290.

Carlson, B. E., A. A. Lacis, and W. B. Rossow 1994. Belt-zone variations in the jovian cloud structure. J. Geophys. Res. 99, 14623–14658.

Conrath, J. B., and P. J. Gierasch 1984. Global variation of the para hydrogen fraction in Jupiter’s atmosphere and implications for dynamics of the outer planets. Icarus 57, 184–204.

Conrath, J. B., and P. J. Gierasch 1986. Retrieval of ammonia abundances and cloud opacities on Jupiter from Voyager IRIS spectra. Icarus 67, 444–455.

Dana, V., J.-Y. Mandin, G. Tarrago, W. B. Olson, and B. Bézard 1993. Absolute infrared intensities in the fundamentals ν_1 and ν_3 of arsine. J. Molec. Spectrosc. 159, 468–480.

de Graauw, T., and 61 colleagues 1996. Observing with the ISO Short-Wavelength Spectrometer. Astron. Astrophys. 315, L49–L54.

de Pater, I. 1986. Jupiter’s zone-belt structure at radio wavelengths. II. Comparison of observations with model atmosphere calculations. Icarus 68, 344–365.

Douglas, A. E. 1963. Electronically excited states of ammonia. Discuss. Faraday Soc. 35, 158–174.

Drossart, P., J.-P. Maillard, M. Roos-Serote, E. Lellouch, and T. Encrenaz 1996. High resolution spectroscopy of the GRS and NEB hot spots of Jupiter following Galileo observations. Bull. Amer. Astron. Soc., 28, 223.

Drossart, P., and 11 colleagues 1998. The solar reflected component in Jupiter’s 5-μm spectra from NIMS/Galileo observations. J. Geophys. Res., 103, 23043–23049.

Eberhardt, P. 1998. Composition of comets: the in situ view. In Cometary nuclei in space and time (M. A’Hearn, Ed.). Atron. Soc. of the Pacific Conf. Series.

Edgington, S. G., S. K. Atreya, L. M. Trafton, J. J. Caldwell, R. F. Beebe, A. A. Simon, R. A. West, and C. Barnet 1998. On the latitude variation of ammonia, acetylene, and phosphine altitude profiles on Jupiter from HST Faint Object Spectrograph observations. Icarus 133, 192–209.

Encrenaz, T., M. Combes, and Y. Zéau 1978. The spectrum of Jupiter between 10 and

13 μ: an estimate of the jovian^{15}N/^{14}N ratio. Astron. Astrophys. 70, 29–36.

Encrenaz, T., and 19 colleagues 1996. First results of ISO-SWS observations of Jupiter. Astron. Astrophys. 315, L397–L400.

Folkner, W. M., R. Woo, and S. Nandi 1998. Ammonia abundance in Jupiter’s atmosphere derived from the attenuation of the Galileo probe’s radio signal. J. Geophys. Res. 103, 22847–22855.

Gautier, D., B. J. Conrath, M. Flasar, R. Hanel, V. Kunde, A. Chedin, and N. Scott 1982. The helium abundance of Jupiter from Voyager. J. Geophys. Res. 86, 8713–8720.

Geiss, J., and P. Bochsler 1982. Nitrogen isotopes in the solar system. Geochim. Cosmochim. Acta 46, 529–548.

Gierasch, P. J., B. J. Conrath, and J. A. Magalhães 1986. Zonal mean properties of Jupiter’s upper troposphere from Voyager infrared observations. Icarus 67, 456–483.

Griffith, C. A., B. Bézard, T. Owen, and D. Gautier 1992. The tropospheric abundances of NH_3 and PH_3 in Jupiter’s Great Red Spot, from Voyager IRIS observations. Icarus 98, 82–93.

Hanel, R., and 14 colleagues 1979. Infrared observations of the jovian system from Voyager 2. Science 206, 952–956.

Husson, N., B. Bonnet, N. A. Scott, and A. Chédin 1992. Management and study of spectroscopic information: the GEISA program. J. Quant. Spectrosc. Radiat. Transfer 48, 509–518.

Jewitt, D. C., H. E. Matthews, T. Owen, and R. Meier 1997. Measurement of^{12}C/^{13}C, 14N/^{15}N,^{32}S/^{34}S ratios in comet Hale-Bopp (C/1995 O1). Science 278, 90–93.

Joiner, J., and P. G. Steffes 1991. Modeling of Jupiter’s millimeter wave emission utilizing laboratory measurements of ammonia (NH_3) opacity. J. Geophys. Res. 96, 17463–17470.

Jouzel, J. 1986. Isotopes in cloud physics: multiphase and multistage condensation process. In Handbook of environmental isotope geochemistry, the terrestrial environment, Vol. 2, (P. Fritz, and J. C. Fontes, Eds.), pp. 61–112. Elsevier, New-York.

Kerridge, J. F. 1980. Accretion of nitrogen during the growth of planets. Nature 283, 183–184.

Kerridge, J. F. 1982. Whence so much^{15}N? Nature 295, 643–644.

Kessler, M. F., and 10 colleagues 1996. The Infrared Space Observatory (ISO) mission. Astron. Astrophys. 315, L27–L31.

Kunde, V., R. Hanel, W. Maguire, D. Gautier, J.-P. Baluteau, A. Marten, A. Chédin, N. Husson, and N. Scott 1982. The tropospheric gas composition of Jupiter’s North Equatorial Belt (NH_3, PH_3, GeH_4, H_2O) and the jovian D/H isotopic ratio. Astrophys. J. 263, 443–467.

Lara, L.-M., B. Bézard, C. A. Griffith, J. H. Lacy, and T. Owen 1998. High-resolution 10-micronmeter spectroscopy of ammonia and phosphine lines on Jupiter. Icarus 131, 317–333.

Lellouch, E., N. Lacome, G. Guelachvili, G. Tarrago, and T. Encrenaz 1987. Ammonia: experimental absolute linestrengths and self-broadening parameters in the 1800- to 2100-cm^{−1} range. J. Mol. Spectrosc. 124, 333–347.

Lellouch, E., P. Drossart, and T. Encrenaz 1989. A new analysis of the jovian 5-μm Voyager/IRIS spectra. Icarus 77, 457–465.

Lévy, A., N. Lacome, and G. Tarrago 1993. Hydrogen- and helium-broadening of phosphine lines. J. Mol. Spectrosc. 157, 172–181.

Majoube, M. 1971a. Fractionnement en oxygène 18 et en deutérium entre l’eau et sa phase vapeur. J. Chim. Phys. Physicochim. Biol. 68, 1423–1436.

Majoube, M. 1971b. Fractionnement en oxygène 18 entre la glace et la vapeur d’eau. J. Chem. Phys. Physicochim. Biol. 68, 625–636.

Margolis, J. S. 1996. H_2 and He broadened methane. J. Quant. Spectrosc. Radiat. Trans. 55, 823–836.

Marten, A., D. Rouan, J.-P. Baluteau, D. Gautier, B. J. Conrath, R. A. Hanel, V. Kunde, R. Samuelson, A. Chedin, and N. Scott 1981. Study of the Ammonia Ice Cloud Layer in the Equatorial Region of Jupiter from the Infrared Interferometric Experiment on Voyager. Icarus 46, 233–248.

Moreno, R. 1998. Observations millimétriques et submillimétriques des planètes géantes. Étude de Jupiter après la chute de la comète SL9. Thèse de Doctorat, Université Paris VI, Paris.

Ortiz, J. L., G. S. Orton, A. J. Friedson, S. T. Stewart, B. M. Fisher, and J. R. Spencer 1998. Evolution and persistence of 5-μm hot spots at the Galileo probe entry latitude. J. Geophys. Res. 103, 23051–23069.

Owen, T., S. Atreya, P. Mahaffy, H. Niemann, and M. H. Wong 1997. On the origin of Jupiter’s atmosphere and the volatiles on the Medicean stars. In Three Galileos: The Man, The Spacecraft, The Telescope, (C. Barbieri, J. Rahe, T. Johnson, and A. Sohus, Eds.), pp. 289–297. Kluwer Academic, Norwell.

Pillinger, C. T. 1984. Light element stable isotopes in meteorites—from grams to picograms. Geochim. Cosmochim. Acta 48, 2739–2766.

Ragent, B., D. S. Colburn, K. A. Rages, T. C. D. Knight, P. Avrin, G. S. Orton, P. A. Yanamandra-Fisher, and G. W. Grams 1998. The clouds of Jupiter: results of the Galileo Jupiter mission probe nephelometer experiment. J. Geophys. Res. 103, 22891– 22909.

Rinsland, C. P., and 11 colleagues 1984. Simultaneous stratospheric measurements of H_2O, HDO, and CH_4 from balloon-borne and aircraft infrared solar absorption spectra and tunable diode laser laboratory spectra of HDO. J. Geophys. Res. 89, 7259–7266.

Roos, M., and 12 colleagues 1993. The upper clouds of Venus: Determination of the scale height from NIMS-Galileo infrared data. Planet. Space Sci. 41, 505–514.

Roos-Serote, M., and 12 colleagues 1998. Analysis of Jupiter NEB hot spots in the

4–5 μm range from Galileo/NIMS observations: measurements of cloud opacity, water, and ammonia. J. Geophys. Res., 103, 23023–23041.

Roos-Serote, M., P. Drossart, T. Encrenaz, R. W. Carlson, and L. Leader 1999. Constraints on the tropospheric cloud structure of Jupiter from spectroscopy in the 5-μm region; a comparison between Voyager/IRIS, Galileo/NIMS and ISO/SWS spectra. Icarus, in press.

Schaeidt, S. G., and 31 colleagues 1996. The photometric calibration of the ISO Short Wavelength Spectrometer. Astron. Astrophys. 315, L55–L59.

Scmitt, B., E. Quirico, F. Trotta, and W. M. Grundy 1998. Optical properties of ices from UV to infrared. In Solar system ices, (B. Shmitt, C. de Bergh, and M. Festou, Eds.), pp. 199–240. Kluwer Academic Publishers, Dordrecht.

Seiff, A., D. B. Kirk, T. C. D. Knight, R. E. Young, J. D. Mihalov, L. A. Young, F. S. Milos, G. Schubert, R. C. Blanchard, and D. Atkinson 1998. Thermal structure of Jupiter’s atmosphere near the edge of a 5-μm hot spot in the north equatorial belt. J. Geophys. Res. 103, 22857–22889.

Sromovsky, L. A., A. D. Collard, P. M. Fry, G. S. Orton, M. T. Lemmon, M. G. Tomasko, and R. S. Freedman 1998. Galileo probe measurements of thermal and solar radiation fluxes in the jovian atmosphere. J. Geophys. Res. 103, 22929–22977.

Terrile, R. J., R. W. Capps, D. E. Backman, E. E. Becklin, D. P. Cruikshank, C. A. Beichman, R. H. Brown, and J. A. Westfall 1979. Infrared images of Jupiter at 5- micrometer wavelength during the Voyager 1 encounter. Science 204, 1007–1008.

Thiemens, M. H., and R. N. Clayton 1981. Nitrogen isotopes in the Allende meteorite. Earth Planet. Sci. Lett. 55, 363–369.

Thode, H. G. 1940. The vapor pressures, heats of vaporization and melting points of N^{14} and N^{15} ammonias. J. Amer. Chem. Soc. 62, 581–583.

Tokunaga, A. T, R. F. Knacke, and S. T. Ridgway 1980. High spatial and spectral resolution 10-μm observations of Jupiter. Icarus 44, 93–101.

Valentijn E. A., and 23 colleagues 1996. The wavelength calibration and resolution of the SWS. Astron. Astrophys. 315, L60–L64.

Table I: Mixing ratios, spectroscopic data and references

Gas Mole Fraction Line parameters Broadening coefficient CH_4 2.1 × 10^{−4} (Niemann et al. 1998) Husson et al. (1992) Margolis (1996) Lellouch et al. (1987) NH_3 to be determined and Brown and Peterson (1994) Husson et al. (1992) PH_3 7 × 10^{−7} (Kunde et at al. 1982) Husson et al. (1992) Levy et al. (1993) CH_3D 2.5 × 10^{−7} (Encrenaz et al. 1996) Husson et al. (1992) same as CH_4 H_2O to be determined Husson et al. (1992) Brown and Plymate (1996) GeH_4 3.0 × 10^{−10} (Drossart et al. 1996) Husson et al. (1992) same as CH_4 AsH_3 2.5 × 10^{−10} (Noll et al. 1990) Dana et al. (1993) same as PH_3

Table II:^{15}N/^{14}N ratios and fractionation coefficients for three different temperature profiles

Lineshape factor cloud transmission δ (%) α δ (%) α δ (%) α Cold profile Nominal profile Hot profile 1.0 -41 1.17 -49 1.23 -73 1.44 cutoff 0.9 -39 1.15 -48 1.22 -73 1.44 at 0.8 -36 1.13 -47 1.21 -73 1.43 50 cm^{−1} 0.7 -32 1.11 -46 1.20 -72 1.43 0.6 -25 1.08 -45 1.19 -72 1.42 1.0 -45 1.20 -52 1.25 -75 1.45 cutoff 0.9 -43 1.18 -52 1.25 -74 1.45 at 0.8 -40 1.16 -50 1.23 -74 1.44 20 cm^{−1} 0.7 -36 1.13 -49 1.22 -73 1.44 0.6 -29 1.10 -48 1.21 -73 1.43 1.0 -40 1.17 -50 1.24 -72 1.43 0.9 -39 1.15 -49 1.22 -72 1.43 χ(ν) = e^{−(ν−ν0)/80} 0.8 -36 1.14 -47 1.21 -72 1.42 0.7 -31 1.11 -47 1.21 -71 1.42 0.6 -25 1.08 -46 1.20 -71 1.41 1.0 -40 1.17 -50 1.25 -72 1.43 0.9 -38 1.16 -49 1.24 -71 1.43 χ(ν) = e^{−(ν−ν0)/30} 0.8 -36 1.14 -48 1.23 -71 1.42 0.7 -31 1.11 -46 1.21 -71 1.42 0.6 -25 1.09 -45 1.20 -71 1.41

Figure Captions

Figure 1 Normalized contribution functions for the NH_3 Q-branch center at 10.73 μm (solid line), a NH_3 line at 10.83 μm (dashed line) and in the “continuum” at 10.91 μm (dash-dotted line). These functions indicate the pressure levels probed by the different NH_3 lines.

Figure 2 Panel a: Comparison between observed (solid line) and synthetic spectra calculated for 10-μmsized NH_3-ice particles (dashed line) and for grey particles (dotted line) in the 10-μm range. Panel b: Absorption cross section of NH_3-ice spheres of 10-μm radius (solid line) and 100-μm radius (dashed line).

Figure 3 NH_3 distributions derived from the 10-μm region for three different temperature profiles: the nominal Galileo-based profile (solid line), a hot profile (nominal profile +2 K) (dotted line), a cold profile (nominal profile −2 K) (dashed-dotted line).

Figure 4 Respective influence of the absorptions due to ammonia and water on the 5- μm window spectrum along with the contributions functions. Panels a and c: ISO-SWS spectrum (solid line) compared with synthetic spectra (dashed-dotted line) in which are included only the absorptions of water (a) and ammonia (c). Panel b: contribution functions in the line of water at 5.21 μm (dash-dotted line) and 4.84 μm (solid line). Panel d: contribution functions in the ammonia line at 5.32 μm (dash-dotted line), 5.2 μm (dashed line) and 4.86 μm(solid line).

Figure 5 Comparison between the observed spectrum (solid lines) and synthetic spectra calculated for an infinitely thin cloud layer located at 1 bar with a transmission of 8%. In the first model (dotted line) the ammonia vertical distribution is contrained to fit the ammonia lines at 5.32, 5.20 and shortward of 5 μm. In the second model (dashed line) the ammonia vertical distribution is constrained to fit the observations longward of 5.25 μm. The arrows indicate NH_3-lines.

Figure 6 Comparison between observed (solid lines) and synthetic spectra calculated for a vertically uniform ammonia profile (dotted lines) and an ammonia profile decreasing with altitude (dashed line). The synthetic spectra are calculated for an infinitely thin cloud based at 1 bar and transmission 8%. The arrows indicate NH_3-lines.

Figure 7 Same as Fig. 7 for a cloud layer located at 1.9 bar with scale height H_p = 0.6 × H_g and transmission 8%. The arrows indicate NH_3-lines.

Figure 8 Best fit NH_3 distributions derived from the 5-μm window for the spatially homogeneous model (solid line) and for the hot spots region in the spatially heterogeneous model (dashed line). The results of Folkner et al. (1998) are displayed in solid triangles, anf the results of Sromovsky et al. (1998) in open circles.

Figure 9 Comparison of calculations with empirically accounting (solid line) and without accounting for multiple scattering. The atmospheric model comes from category 8 spectra of Carlson et al. (1993). The calculations are convolved to the IRIS resolution.

Figure 10 Comparison between the observed spectrum (solid lines) and the synthetic spectrum (dashed lines) calculated with the spatially heterogeneous model described in section 3.1.2, for an infinitely thin cloud layer located at 1 bar (panel a) and for a cloud layer located at 1.9 bar with scale height H_p = 0.4 × H_g.

Figure 11 Test for the Galileo probe derived vertical profiles of NH_3 (dotted line Sromovsky et al. (1998); dashed line Folkner et al. (1998)) against the ISO-SWS data (solid line).

Figure 12 Comparison between the observed spectrum at 4.8–5.5 μm (solid lines) and a synthetic spectrum (dashed lines) calculated with the thick water cloud located at 5 bar. For NH_3 the spatially heterogenous model is used.

Figure 13 Comparison at 9.5–11.5 μm between the observed spectrum (solid line) and synthetic spectra calculated for δ = 0% (dotted lines) and δ = −50% (dashed line). The arrows indicate^{15}NH_3-lines.

Figure 14 Zoom on the 10.88- and 11.07-μm^{14}NH_3 and^{15}NH_3 lines. The observed spectrum (solid line) is compared with a synthetic spectrum calculated for a terrestrial isotopic ratio (dashed line) and with a synthetic spectrum calculated for δ = −50% (dashed-dotted line).

Figure 15 Comparison at 9.5–11.5 μm between observed (solid line) and synthetic spectra (dotted line) calculated for temperature profile 8 K colder than the nominal Galileobased temperature profile. The ammonia vertical profile is constrained to fit the^{14}NH_3 at 10.88 μm and the surrounding continuum. The^{15}N/^{14}N isotopic ratio is terrestrial.