arXiv:astro-ph/0611803v1 27 Nov 2006

High-Precision Measurements of Δα/α from QSO Absorption Spectra

Sergei A. Levshakov^1, Paolo Molaro^2, Sebastian Lopez^3, Sandro D’Odorico^4, Miriam Centurión^2, Piercarlo Bonifacio^{2,5}, Irina I. Agafonova^1, and Dieter Reimers^6

1 Department of Theoretical Astrophysics, Ioffe Physico-Technical Institute, Politekhnicheskaya Str. 26, 194021 St. Petersburg, Russia 2 Osservatorio Astronomico di Trieste, Via G. B. Tiepolo 11, 34131 Trieste, Italy 3 Departamento de Astronomía, Universidad de Chile, Casilla 36-D, Santiago, Chile 4 European Southern Observatory, Karl-Schwarzschild-Strasse 2, D-85748 Garching bei München, Germany 5 Observatoire de Paris 61, avenue de l’Observatoire, 75014 Paris, France 6 Hamburger Sternwarte, Universität Hamburg, Gojenbergsweg 112, D-21029 Hamburg, Germany

Summary. Precise radial velocity measurements (δv/c ∼ 10^{−7}) of Fe ii lines in damped Lyα systems from very high quality VLT/UVES spectra of quasars HE 0515–4414 and Q 1101–264 are used to probe cosmological time dependence of the fine structure constant, α. It is found that between two redshifts z1 = 1.15 and z2 = 1.84 the value of Δα/α changes at the level of a few ppm: (αz_2 − αz_1 )/α0 = 5.43 ± 2.52 ppm. Variations of α can be considered as one of the most reliable method to constrain the dark energy equation of state and improvements on the accuracy of the wavelength calibration of QSO spectra are of great importance.

1 Introduction

The late-time acceleration of the universe discovered from the luminosity distance measurements of high-redshift SNe Ia is now regarded as evidence for the existence of dark energy. In many models, the cosmological evolution of dark energy is accompanied by variations in coupling constants as, e.g., the fine-structure constant α [1]. Since theories predict different behavior of dark energy, from slow-rolling to oscillating, to study its dynamics the coupling constants must be measured with highest accuracy at each redshift.

In order to fulfill this requirement we developed a method called ‘Single Ion Differential α Measurement, SIDAM’ [2, 3, 4, 5]. Based on the measurements of the relative line position of only one element Fe ii, it is free from many systematics which affect other methods, e.g., [6, 7]. It has been shown that SIDAM can provide a sub-ppm precision at a single redshift and that this level of accuracy is mainly caused by systematic errors inherited from the uncertainties of the wavelength scale calibration [5] (ppm stands for parts per million, 10^{−6}).

Fig. 1. Histograms are the combined Fe ii profiles from the z = 1.84 damped Lyα system towards Q 1101–264 [8]. The zero radial velocity is fixed at z_{abs} = 1.838911. The synthetic profiles are over-plotted by the smooth curves. The normalized residuals, (F^{cal}_i − F^{obs}_i )/σi, are shown by dots (horizontal dotted lines restrict the 1σ errors). The dotted vertical lines mark positions of the sub-components. Bold horizontal lines mark pixels used to minimize χ^2. The ranges at v < −50 km s^{−1} and at v ≃ −30 km s^{−1} in the Fe ii λ2600 profile are blended with weak telluric lines.

In this presentation we consider our recent results [8] with the SIDAM procedure obtained from the analysis of very high resolution (FWHM ≃ 3.8 km s^{−1}, slit width 0.5 arcsec) and high signal-to-noise (S/N = 100-120 per pixel) spectra of Q 1101–264 (z_{em} = 2.15, V = 16.0). The observations were performed at the VLT Kueyen telescope on 21-23 February, 2006 under the ESO programme No. 076.A-0463. The total exposure time was 15.4 hours.

2 Results

The spectroscopic measurability of Δα/α ≡ (α_z − α_0)/α_0 at redshift z (α_0 refers to the z = 0 value) is based on the fact that the energy of each line transition depends individually on a change in α [9]. It means that the relative change of the frequency ω_0 due to varying α is proportional to the so-called sensitivity coefficient Q = q/ω_0 [4]. The q-values for the resonance UV transitions in Fe ii are taken from [10], and their rest frame wavelengths — from [8, 11].

The value of Δα/α can be measured from the relative radial velocity shifts between lines with different sensitivity coefficients. In linear approximation

High-precision Δα/α from QSO spectra 3

Fig. 2. χ^2 as a function of the velocity difference Δv between the Fe ii λ1608 and λ2382/2600 lines [8]. The number of data points M = 305, the number of degrees of freedom ν = 257. The minimum of the curve at Δv = −0.18 km s^{−1} gives the most probable value of Δα/α = 5.36 ppm. The 1σ confidence level is determined by Δχ^2 = 1 (dashed line) which gives σΔv = 0.08 km s^{−1} or σ_{Δα/α} = 2.38 ppm.

(|Δα/α| ≪ 1) we have [5]: Δα α = (v_2 − v_1) 2 c (Q_1 − Q_2) = Δv 2 c ΔQ , (1)

where index ‘1’ is assigned to the line λ1608, and index ‘2’ marks one of the other Fe ii lines (λ2382 or λ2600).

The resulting normalized, vacuum-barycentric, and co-added spectra are shown in Fig. 1. Two independent data reduction procedures (1D and 2D) resulted in almost identical co-added spectra. We found a perfect fit of the Fe ii profiles to a 16-component model (shown by the smooth curves in Fig. 1): the normalized χ^2 per degree of freedom equals χ^2_ν = 0.901 (ν = 257). The computational procedure was the same as in [5]. Since the Q values for the λ2382 and λ2600 lines are equal, their relative velocity shift, Δv_{2600−2382}, characterizes the goodness of wavelength calibrations, σ_{scale}, of the corresponding echelle orders. We found that the value of Δv_{2600−2382} = 20 m s^{−1} is comparable with σ_{scale} ≤ 20 m s^{−1} estimated from the ThAr lines. So, in what follows we consider the λ2382 and λ2600 lines as having the same radial velocity, and calculate Δv between this velocity and that of the line λ1608.

The radial velocity shift between the λ1608 and λ2382/2600 lines was derived by comparing synthetic profiles with their observed profiles and minimizing χ^2. To find the most probable value of Δv, we fit the absorption lines with a fixed Δv, changing Δv in the interval from −270 m s^{−1} to −90 m s^{−1} in steps of 10 m s^{−1} (see Fig. 2). For each Δv, the strengths of the subcomponents, their broadening parameters and relative velocity positions were allowed to vary in order to optimize the fit and thus minimize χ^2(Δv). The most probable value of Δv corresponds to the minimum of the curve χ^2(Δv).

In our case it is −180 m s^{−1}. The 1σ confidence interval to this value is given by the condition Δχ^2 = χ^2 − χ^2_{min} = 1 (the horizontal dashed line in Fig. 2. It is seen from the figure that σ_{Δv} = 80 m s^{−1}, or Δα/α = 5.36 ± 2.38 ppm.

We have specifically investigated those systematic effects which could introduce a non-zero difference between the blue and the red lines (λ1608 and λ2382/2600, respectively) and thus simulate a variation of Δα/α at the ppm level: (1) possible isotopic shifts caused by unknown isotope abundances, (2) effects of the unresolved components, and (3) possible blends. We also compared our previous results [8], where Fe ii lines falling in both UVES arms were used, with the present measurements to check up possible shifts caused by different changes of isophote onto the slit during integration and did not reveal any of them. We found that the largest systematic error does not exceed 30 m s^{−1}, i.e. σ_{Δα/α,sys} ≤ 0.89 ppm [8].

We note that the accuracy of σ_{Δα/α} = 2.38 ppm represents a factor of 1.5 improvement with respect to our previous result σ_{Δα/α} = 3.8 ppm [4] obtained from the archive data of lower resolution (F W HM ≃ 6 km s^{−1}) but the same S/N ratio. Thus the higher spectral resolution is shown to significantly contribute to higher accuracy in the Δα/α measurements.

The comparison of Δα/α = −0.07 ± 0.84 ppm at z_1 = 1.15 towards HE 0515–4414 [5] with the measured quantity Δα/α = 5.36 ± 2.38 ppm at z_2 = 1.84 shows a tentative change of the value of Δα/α between these two redshifts: (α_{z2} − α_{z1} )/α_0 = 5.43 ± 2.52 ppm.

Acknowledgments. SAL acknowledges supports from the RFBR grant No. 06-02-16489, the Federal Agency for Science and Innovations grant NSh 9879.2006.2, and the DFG project RE 353/48-1.

References

1. P. P. Avelino, C. J. A. P. Martins, N. J. Nunes, & K. Olive: Phys. Rev. D 74, 083508 (2006) 2. S. A. Levshakov: Astrophysical constraints on hypothetical variability of fundamental constants. In: Astrophysics, Clocks and Fundamental Constants, ed by S.G. Karshenboim, E. Peik (Springer, Berlin Heidelberg New York 2004) pp 151–166 3. R. Quast, D. Reimers, & S. A. Levshakov: A&A 415, L7 (2004) 4. S. A. Levshakov, M. Centurión, P. Molaro, & S. D’Odorico: A&A 434, 827 (2005) 5. S. A. Levshakov, M. Centurión, P. Molaro, et al: A&A 449, 879 (2006) 6. M. T. Murphy, J. K. Webb, & V. V. Flambaum: MNRAS 345, 609 (2003) 7. H. Chand, R. Srianand, P. Petitjean, & B. Aracil: A&A 417, 853 (2004) 8. S. A. Levshakov, P. Molaro, S. Lopez et al: A&A, submit. (2006) 9. J. K. Webb, et al: Phys. Rev. Lett. 82, 884 (1999) 10. V. A. Dzuba, et al: Phys. Rev. A 66, 022501 (2002) 11. M. Aldenius, S. Johansson, & M. T. Murphy: MNRAS 370, 444 (2006)