arXiv:astro-ph/0610442v1 14 Oct 2006

The shape of the UV ionizing background is reconstructed from optically thin metal absorption-line systems identified in spectra of HE 2347–4342, Q 1157+3143, and HS 1700+6416 in the redshift interval 1.8 < z < 2.9. The systems are analyzed by means of the Monte Carlo Inversion method completed with the spectral shape recovering procedure. The UVB spectral shape fluctuates at 2.4 < z < 2.9 mostly due to radiative transfer processes in the clumpy IGM. At z <∼ 1.8, the IGM becomes almost transparent both in the H I and He II Lyman continua and the variability of the spectral shape comes from diversity of spectral indices describing the QSO/AGN intrinsic radiation. At z > 2.4, the recovered spectral shapes show intensity depression between 3 and 4 Ryd due to He II Lyα absorption in the IGM clouds (line blanketing) and continuous medium (true Gunn-Petersen effect). The mean He II Lyα opacity estimated from the depth of this depression corresponds within 1-2σ to the values directly measured from the H I/He II Lyα forest towards the quasars studied. The observed scatter in η = N(He II)/N(H I) and anti-correlation between N(H I) and η can be explained by the combined action of variable spectral softness and differences in the mean gas density between the absorbing clouds. Neither of the recovered spectral shapes show features which can be attributed to the putative input of radiation from soft sources like starburst galaxies.

Key words. Cosmology: observations – Line: formation – Line: profiles – Galaxies: abundances – Quasars: absorption lines – Quasars: individual: HE 2347–4342, Q 1157+3143, HS 1700+6416

Astronomy & Astrophysics manuscript no. ms5721 April 23, 2019 (DOI: will be inserted by hand later)

Spectral shape of the UV ionizing background and He II absorption at redshifts 1.8 < z < 2.9^⋆

I. I. Agafonova^{1⋆⋆}, S. A. Levshakov^{1⋆⋆⋆}, D. Reimers^1, C. Fechner^1, D. Tytler^2, R. A. Simcoe^3, and A. Songaila^4

1 Hamburger Sternwarte, Universität Hamburg, Gojenbergsweg 112, D-21029 Hamburg, Germany 2 Department of Physics and Center for Astrophysics and Space Sciences, University of California, San Diego, MS 0424, La Jolla, CA 92093-0424, USA 3 MIT Center for Space Research, 77 Massachusetts Ave, 37-664B, Cambridge, MA 02139, USA 4 Institute of Astronomy, University of Hawaii, 2680 Woodlawn Drive, Honolulu, HI 96822, USA

received date; accepted date

Abstract.

1. Introduction

This paper continues our study of the UV ionizing background (UVB) of the metagalactic radiation in the range 1-10 Ryd as reconstructed from optically thin QSO metal absorption systems. In the previous papers, our analysis of the absorbers at z ≈ 3 (Agafonova et al., 2005, hereafter Paper I) and in the range 1.46 < z < 1.8 (Reimers et al., 2006, hereafter Paper II) has led to the following conclusions:

1. At z ≈ 3, the spectral shape of the UV ionizing radiation

shows a sharp reduction in flux in the energy range 3 Ryd < E < 4 Ryd which can be interpreted as manifestation of the He II Gunn-Petersen effect — He II Lyα continuous absorption in the intergalactic medium.

2. At z < 1.8, the ionizing spectra turn out to be much harder

at E ≥ 3 Ryd as compared to model spectra of Haardt & Madau (1996, hereafter HM). This indicates that intergalactic clouds with N(H I) > 10^{15} cm^{−2} responsible for the He II break (absorption in the He II Lyman continuum) become more rare at low z than was supposed by the cloud statistics in HM.

3. The ionizing background both at z ≈ 3 and at z < 1.8 is

dominated by radiation from QSO/AGNs. The input of the soft radiation from galaxies/stars is negligible, limiting the escape fraction of the galactic UV photons to f_{esc} < 0.05.

Send offprint requests to: S. A. Levshakov lev@astro.ioffe.rssi.ru ⋆ Based on observations obtained at the VLT Kueyen telescope (ESO), the W. M. Keck Observatory and the HST ⋆⋆ On leave from Ioffe Physico-Technical Institute, St. Petersburg, Russia ⋆⋆⋆ On leave from Ioffe Physico-Technical Institute, St. Petersburg, Russia

In the present paper, we reconstruct the underlying UVB using metal absorbers from the range 1.8 < z < 2.94 identified in spectra of three bright QSOs: HE 2347–4342 (z_{em} = 2.88), Q 1157+3143 (z_{em} = 2.96), and HS 1700+6416 (z_{em} = 2.74). In the considered redshift range, the shape of the UVB is closely related to the process of He II reionization in course of cosmic time. Recent observations of the H I/He II Lyα forest towards HE 2347–4342 (Shull et al. 2004; Zheng et al. 2004, hereafter Z04) and HS 1700+6416 (Fechner et al. 2006a, hereafter F06) revealed (i) significant fluctuations of the ratio η = N(He II)/N(H I), (ii) anti-correlation between η and N(H I), and (iii) decrease of median η towards lower z. Although a large part of the scatter of η seems to be artificial and caused by noise in He II data, errors in H I and He II column densities, unidentified blends etc. (see F06), similarity of the results obtained both for the HE 2347–4342 and HS 1700+6416 sightlines supposes that spatial fluctuations of η do really exist. These fluctuations suggest a variable softness S = J_{912}/J_{228} of the metagalactic radiation field with higher η value corresponding to softer UVB. A diversity of the spectral indices describing QSO continuum radiation, an input of radiation from soft sources of type starburst galaxies, and radiative transfer through clumpy media are the reasons usually considered for the UVB variability. Calculations of the UVB spectra accounting for all these effects are still well beyond modern computational facilities, although some attempts to explain the observed scatter of η via the modeling of the H I/He II Lyα forest have been made (Maselli & Ferrara 2005; Bolton et al. 2006). Thus, direct reconstructions of the UVB spectral shape from metal absorption-line systems at different redshifts and along different sightlines can help to clarify the character of the UVB fluctuations and to determine the sources of the ionizing background.

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 3

The paper is organized as follows. Sect. 2 contains some qualitative information outlining main steps in the UVB recovering procedure. Selected absorption systems are analyzed in Sect. 3. The obtained results are discussed and summarized in Sects. 4 and 5.

2. Recovering the shape of the underlying radiation field

Computational procedure used to recover the spectral shape of the ionizing radiation from optically thin metal systems is described in Paper I. Here we briefly outline the basics needed to understand the results presented below in Sect. 3.

Absorption systems are analyzed by means of the Monte Carlo Inversion (MCI) procedure (Levshakov, Agafonova & Kegel 2000, hereafter LAK; Levshakov et al. 2002, 2003a,b). The MCI is based on the assumption that all lines observed in the absorption system are formed in a cloud where the gas density and velocity are random functions of the coordinate x along the cross line. It is also assumed that the metal abundance throughout the cloud is constant, the gas is in thermal and ionization equilibrium and optically thin for the ionizing UV radiation. This implies that ion fractions are determined entirely by the gas density n_H(x) [or, equivalently, by the ionization parameter U(x) ∝ 1/n_H] and by the spectral energy distribution of the background ionizing radiation in the range 1–10 Ryd (defined by the ionization edges of the observed metal ions — from Si II to O VI, see Fig. 1).

Since the gas density varies from point to point along the sightline, the ion fractions vary as well. Thus, for a given point within the line profile the observed intensity results from a mixture (superposition) of different ionization states of the gas due to irregular Doppler shifts of the local absorption coefficient (see Fig. 1 in LAK). The dependence of the ion fraction on the gas density (ionization curve) is different for each ion and this is why the line profiles differ in spite of being produced by the same gas cloud.

The following physical parameters are directly estimated in the computational procedure: the mean ionization parameter U_0, the total hydrogen column density N_H, the line-of-sight velocity dispersion, σ_v, and density dispersion, σ_y, of the bulk material [y ≡ n_H(x)/n_0], and the chemical abundances Z_a of all elements included in the analysis. With these parameters we can further calculate the column densities for different species N_a, and the mean kinetic temperature T_{kin}. Given the absolute intensity of the UV background, the mean gas number density, n_0, and the line-of-sight thickness, L, of the absorber can be evaluated as well.

An advanced version of the MCI completed with the procedure of the spectral shape recovering (referred to as MCISS hereafter) is iterative and works as follows. At first, some basic ionizing spectrum (e.g. HM for corresponding redshift) is taken as an initial approximation. To calculate the ionization curves needed to carry out the MCI calculations this basic UVB is inserted into the photoionization code CLOUDY (Ferland 1997) together with some guesses about relative element abundances and metallicity. Then the MCI run is performed with the ionization curves taken as external parameters. If the resulting (recov-

Fig. 1. Schematic picture of metagalactic ionizing spectrum (solid thick line) as predicted by model calculations (Haardt & Madau 1996; Fardal et al. 1998). The spectrum is normalized so that Jν (hν = 1 Ryd) = 1. The emission bump at 3 Ryd is caused by reemission of He II Lyα, He II two-photon continuum emission and He II Balmer continuum emission from intergalactic clouds. The positions of ionization thresholds of different ions are indicated by tick marks. The definition of factors {fi} is given in Sect. 2. Dashed line shows the spectral shape recovered from metal absorbers at z ∼ 3. The continuum depression between 3 and 4 Ryd (Ic − IGP) is due to He II Lyα absorption in the IGM (the He II Gunn-Peterson effect).

ered) relative abundances and the gas metallicity differ from the initial guess, the ionization curves are re-calculated with these current quantities and new MCI runs are performed till the recovered metallicity and element ratios correspond to those used to calculate the ionization curves. If this solution reproduces all line profiles within their uncertainties and no other peculiarities arise (like relative overabundances of elements which are well beyond observational and theoretical constraints), then we can consider the assumed ionizing spectrum as consistent with observations. If, however, the line intensities come over- /underestimated and/or relative element ratios are odd, then the spectral shape of the ionizing radiation is to be adjusted.

The spectral shape adjustment procedure itself is developed on base of the response surface methodology used in the theory of experimental design. It includes (i) the parameterization of the spectral shape by means of a set of variables (called ‘factors’), (ii) the choice of a quantitative measure (called ‘response’) to evaluate goodness of a trial spectral shape, and (iii) the estimation of a direction in the factor space which leads to a spectrum with the better goodness. Moving along this direction, we come from the initial spectral shape to the one with better characteristics concerning the fitting of the observed line intensities. Now the MCI calculations are carried out with this newly obtained ionizing spectrum and the whole procedure is

4 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

Fig. 3. Hydrogen and metal absorption lines associated with the z_{abs} = 2.735 system towards HE 2347–4342 (histograms). Synthetic profiles corresponding to the recovered ionizing spectrum (dashed line in Fig. 4) are plotted by the smooth curves. The physical parameters are listed in Table 1, Col. 2. Bold horizontal lines mark pixels included in the objective function of the MCI procedure. The zero radial velocity is fixed at z = 2.73576. The central positions of blends are indicated by tick marks.

repeated till the optimal spectral shape is found, i.e. one which allows to reproduce the observed intensities of all lines without any physical inconsistencies.

How well the spectral shape can be recovered depends on the number of metal lines involved in the analysis: the more lines of different ionic transitions of different elements are detected in the absorption system, the better constrained is the allowable set of the spectral shapes. Any available a priori information concerning, e.g., the expected element ratios should be also taken into consideration in order to distinguish between possible solutions.

Fig. 1 schematically shows the spectrum of the metagalactic radiation as obtained in model calculations (Haardt & Madau 1996; Fardal et al. 1998) and illustrates its parameterization by a set of factors. These are: f_1 – the slope (power law exponent) between 1 Ryd and the He II ionization break; f_2 – the energy at which the He II break starts (point A); f_3 – the depth of the He II ionization break, log(J_B/J_A); f_4 – the slope between A and B; f_5 – the slope between B and C; f_6, f_7 – the height and width of the He II re-emission bump. The energy of the far UV cut off (point C) when taken above 100 Ryd does not effect the fractional ionizations of ions we are interesting in. In all computations described in the subsequent sections this energy and the slope after it are kept fixed at 128 Ryd and −1.5, respectively.

Studying the UVB at z ≈ 3, we found that metagalactic ionizing spectra reveal a sharp depression in the intensity between 3 and 4 Ryd which was interpreted as manifestation of the He II Gunn-Petersen (GP) effect^1 (Paper I). Thus, additional factor f_8 was introduced to describe the depth of the GP depression approximated by a straight step. Knowing this depth, I_{GP}, and the continuum level I_c at E = 3 Ryd (see Fig. 1), the effective He II Lyα line opacity due to absorption in the intergalactic diffuse gas can be estimated as τ_{eff} = ln(I_c/I_{GP}).

Several absorption systems in the present work have neutral hydrogen column densities in the range 10^{16} cm^{−2} < N(H I) < 10^{17} cm^{−2} , and thus are optically thin in the hydrogen Lyman continuum, but can be optically thick in the He II Lyman continuum. In Paper I we found that such systems can be described with an average ionizing spectrum which reflects both the external (He II GP absorption) and local effects (strong attenuation at E > 4 Ryd due to He II continuum absorption in the cloud itself and an enhanced peak at E = 3 Ryd due to recombining emission of He II Lyα). An example of such average spectrum is plotted by the dashed line in Fig. 1 .

Fig. 2 shows ionization curves of carbon and silicon ions calculated for this spectrum in comparison to those calculated for the spectrum of HM (z = 3). The intensity depletion in the range 3 < E < 4 Ryd strongly affects ionization fractions of carbon leading to enhanced ratios of C II/C IV and C III/C IV at log U >∼ −2.5. The dependence of silicon ion fractions on I_{GP} is rather weak, but they are sensitive to photons with energies E ≤ 3 Ryd — an enhanced intensity in this range leads to a higher Si IV/Si II ratio.

1 In the present context we consider the GP effect as being caused by combined action of line blanketing and He II Lyα absorption in continuous intergalactic medium (true GP effect).

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 5

Fig. 2. Ionization fractions of carbon (upper panel) and silicon (lower panel) calculated for metallicity Z = 0.01Z⊙ . Thick curves correspond to the UBV shown by the solid line in Fig. 1, thin curves — to the UVB shown by dashed line.

To complete this section, some words should be said about the evaluation of η. In the systems under study, we observe lines of neutral hydrogen, but we do not have spectral ranges with the corresponding He II lines. Nevertheless, assuming that all lines arise in the same gas and reconstructing the velocity and density distributions of the absorbing material from available hydrogen and metal line profiles, we are able to estimate the column density of single ionized helium as well. The ionization corrections of He II needed for this estimation are calculated using CLOUDY with the recovered UVB spectral shape, metallicity and element abundance ratios as inputs.

3. Analysis of individual absorption systems

From a wealth of metal absorption systems identified in the spectra of HE 2347–4342, Q 1157+3143, and HS 1700+6416 only a few turned out to be suitable for the UVB recovering. These metal absorption-line systems are described in detail in the subsections below.

In general, the uncertainties of the fitting parameters U_0, N_H, σ_v , σ_y , and Z_a listed in Tables 1, 2 and 3 are about 15%– 20% (for data with S/N >∼ 30).

All computations were performed with laboratory wavelengths and oscillator strengths taken from Morton (2003) for λ > 912 Å and from Verner et al. (1994) for λ < 912 Å. Solar abundances were taken from Asplund et al. (2004). Note that their solar abundance of nitrogen, N/H = 6×10^{−5} , is 1.4 times (0.15 dex) lower then that previously reported in Holweger (2001).

Fig. 4. The ionizing background spectrum predicted for z = 3 and z = 2 in HM (thick and thin solid lines, respectively) and the spectra restored for z = 2.73 (dashed lines) and z = 1.79 (dotted line). The normalization is the same as in Fig. 1.

The intensity J_{912} needed to convert the obtained U_0 values into the gas density was taken from HM.

3.1. Absorption systems towards HE 2347–4342

We used for our analysis the VLT/UVES spectrum of HE 2347–4342. Observations and data processing are described in Shull et al. (2004).

3.1.1. Absorption systems at z = 2.735, 2.739 and 2.741

These three absorption systems have a joint column density of N(H I) = 2.8 × 10^{17} cm^{−2} (measured from Lyα discontinuity in the QSO spectrum). The system at z_{abs} = 2.735 (Fig. 3) exhibits all silicon and carbon transitions from single to triple ionized species, N III λ989 Å (partially blended) and O III λ832 Å (albeit from very noisy part of the spectrum). Expected positions of O VI λλ1032, 1037 Å are blocked with Lyα forest absorptions. Test calculations with the HM ionizing spectrum ended up with synthetic line profiles which significantly overestimated the observed intensity of Si II and underestimated intensities of Si IV and C II. Such behavior of synthetic lines along with the procedure of spectral shape adjustment were already described in detail in Paper I, Sect.3.1. The final spectral shape that we obtained is shown by the dashed line in Fig. 4 with corresponding physical parameters given in Table 1, Col.2 and synthetic profiles plotted by the smooth lines in Fig. 3.

The adjusted ionizing spectrum is much softer at E > 4 Ryd than the initial spectrum of HM and has a strong emis-

6 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

sion peak at E = 3 Ryd (needed to reproduce the observed Si II/Si IV ratio). At the same time, the observed ratio of C II/C IV cannot be reproduced without a significant drop in the intensity between 3 and 4 Ryd. The obtained UVB shape resembles that of z_{abs} = 2.9171 system towards HE 0940–1050 (Paper I, Sect.3.1) and reflects both local (attenuation at E > 4 Ryd and enhanced He II Lyα emission at E = 3 Ryd) and external (GP depression at 3 < E < 4 Ryd due to intergalactic He II Lyα absorption) effects. From the I_{GP} value the effective optical depth of the intergalactic He II Lyα absorption at z_{abs} = 2.735 is estimated as τ^{He II}_{GP} = 1.45 ± 0.2. The calculated He II column density is 7.4 × 10^{18} cm^{−2} which gives η = 150.

Two close absorption systems at z_{abs} = 2.739 and z_{abs} = 2.741 have metal lines either heavily blended or weak and noisy leading to the consequence that the observed profiles can be reproduced within a broad range of spectral shapes. In any case, the UVB recovered from the z_{abs} = 2.735 system is consistent with these systems and delivers reasonable physical parameters. They are listed in Table 1, Cols. 2 and 3, with corresponding synthetic profiles plotted in Figs. 5 and 6 (smooth lines). Note an extremely low metallicity of [Z] ≃ −3.5 in the sub- LLS at z_{abs} = 2.741 along with its huge linear size of L > 250 kpc. In spite of all uncertainties immanent to this absorber, these values can be considered as reliable: the C III/C IV ratio is similar to that found in the z_{abs} = 2.735 system (it implies the same mean ionization parameter and gas density), but there is three times more neutral hydrogen and an order of magnitude less C III, C IV and Si IV. As far as we know, this is the lowest metallicity ever directly measured in a Lyα forest absorber.

An important result is that a significant difference in η between the z_{abs} = 2.739 absorber (η = 50) and two other absorbers (η ≃ 150) stems not from variations in the ionizing background (all quantities have been obtained with the same ionizing spectrum) but entirely from differences in the gas density: n_H = 6.0 × 10^{−3} cm^{−3} at z_{abs} = 2.739 and (7-9)×10^{−4} cm^{−3} at z_{abs} = 2.741 and 2.735 (see also Fig. 19 below).

It is also worth noting that these three absorbers are located in the vicinity of the He II transmission window at 2.716 < z < 2.726 marked by ‘K’ in Figs. 1f and 5 in Z04.

In all three systems we measured [Si/C] ≃ 0 − 0.1. In order to interpret this value correctly the following considerations should be taken into account. The system at z_{abs} = 2.735 used to restore the UVB is optically thin in H I but opaque in He II which supposes that radiation transfer effects can be significant. The average spectrum is appropriate to describe the line profiles, but it can produce biased abundances. Computational experiments with different spectral shapes of the UVB have shown that softening at E > 4 Ryd affects more significantly the abundance of silicon making the recovered ratio [Si/C] lower. In general, the change of [Si/C] does not exceed 0.2 dex. This allows to set an upper bound to [Si/C] in the these systems: [Si/C] <∼ 0.3. This value is fully consistent with [Si/C] measured recently in an extremely metal-poor DLA: [C] = −2.83 ± 0.05, [Si] = −2.57 ± 0.05 (Erni et al. 2006), and with measurements in metal-poor stars: [Si/C] < 0.3 at [Mg] < −3 (Cayrel et al. 2004).

The systems show a strong underabundance of nitrogen compared to the solar value: [N/C] < −0.5

3.1.2. Absorption system at z_{abs} = 1.7963

This system was firstly identified through its unusually strong Mg II lines (Fig. 7). It also contains absorption lines of O I λ1302 Å, C II λ1334 Å (blended), Si II λλ1260, 1193, 1190, 1526, and 1304 Å, Fe II λλ2600, 2382 Å, Al III λλ1854, 1862 Å, Si_{III} λ1206 Å, C_{IV} λ1548 Å, and Si_{IV} λλ1393, 1402 Å. Unfortunately, positions of N_V λλ1238, 1242 Å coincide with Lyα forest absorptions, and both lines of the O VI doublet fall beyond the available wavelength coverage. From hydrogen lines, only a noisy Lyα is present and its blue wing is blended. However, in spite of this uncertainty the available set of metal lines and especially the silicon transitions make it possible to estimate the shape of the underlying UVB ionizing radiation.

Firstly, the O I λ1302 Å line is observed together with C IV. O I traces neutral hydrogen and its ion fraction is practically independent on the UVB spectral shape at E > 1 Ryd. The presence of O I supposes the ionization parameter U ≤ 10^{−3}, otherwise the fraction of neutral oxygen becomes too small and the resulting overabundance of oxygen to silicon or carbon would exceed 1 dex compared to solar values.

Secondly, all low ionization metal lines exhibit simple profiles and have the same FWHM of 16 km s^{−1} (b-parameter equals 8.7 km s^{−1} ), which assumes turbulent motion as the main source of the line broadening. Even with this underestimated b-parameter (thermal component in the broadening of the hydrogen line is neglected) the neutral hydrogen column density of a few 10^{16} cm^{−2} leads already to a significant overestimation of the intensity in the unblended red wing. This means that the absorption system is optically thin in the hydrogen continuum and the self-shielding as a reason for the simultaneous presence of O I and C IV can be excluded. Thus, the only remaining option to observe a pronounced C IV absorption at U <∼ 10^{−3} is to have an ionizing spectrum which is very hard at E > 4 Ryd.

Actually, such type of spectrum was recovered by us for the absorption system at z_{abs} = 1.78 towards HE 0141–3932 exhibiting a similar set of ions (Reimers et al. 2005a). So, it was naturally to take that spectral shape as an initial guess for the system under study. Test runs have shown that the observed intensities of silicon lines can be matched only with metallicities of 2.5-3Z_⊙, otherwise the Si III line comes strongly overestimated for all tried spectral shapes. This behavior is explained by a strong dependence of the silicon ion fractions on temperature which at metallicities near and above solar overrides the dependence on spectral shape.

These considerations allow us to construct the UVB spectrum appropriate for the z_{abs} = 1.796 absorption system (Fig. 4, dotted line). Due to many uncertainties stated above this spectral shape is not unique. For example, the power index for the slope at 1 < E < 4 Ryd can be higher or lower. This will mostly affect the ratio C/Si making it above solar in case of a steeper slope. From this point of view a hard slope is preferable. However, the depth of the He II break at 4 Ryd can be constrained: intensities at E = 4 Ryd below 0.06J_{912} lead to a strong overabundance of oxygen to silicon and to carbon ([O/Si,C] > 0.2), and ought to be excluded.

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 7

Table 1. Physical parameters of the z_{abs} = 2.735, 2.739, 2.741 and 1.796 metal absorbers towards HE 2347–4342 derived by the MCISS procedure with the recovered UV background spectra shown in Fig. 4. Column densities are given in cm^{−2}

Parameter^a z_{abs} = 2.735 z_{abs} = 2.739 z_{abs} = 2.741 z_{abs} = 1.796 (1) (2) (3) (4) (5)

U0 3.3E–2 4.4E–3 4.3E–2 2.0E–3 NH 2.3E20 7.3E19 5.9E20 2.0E17 σv, km s^{−1} 25.0 24.0 21.0 15.0 σy 0.6 0.5 0.7 0.6 ZC 2.4E–6 1.2E–6 7.3E–8 7.4E–4 ZN <2.0E–7 <∼ 8.0E–8 . . . . . . ZO 5.0E–6 . . . . . . 1.3E–3 ZMg . . . . . . . . . (1.4-2.5)E–4 Z_{Al} . . . . . . . . . 1.1E–1 ZSi 4.3E–7 1.5E–7 1.0E–8 9.5E–5 ZFe . . . . . . . . . 2.3E–5 [ZC] −2.00 −2.30 −3.53 0.48 [ZN] < −2.5 <∼ − 2.87 . . . . . . [ZO] −2.00 . . . . . . 0.45 [ZMg ] . . . . . . . . . 0.60-0.85 [Z_{Al}] . . . . . . . . . 0.6 [ZSi] −1.90^c −2.34^c −3.53^c 0.46 [ZFe] . . . . . . . . . −0.08 N(H I) (4.9 ± 0.5)E16 (8.6 ± 1.0)E16 (1.4 ± 0.2)E17 (9.1 ± 2.0)E15 N(O I) . . . . . . . . . (1.0 ± 0.2)E13 N(C II) (7.1 ± 0.5)E12 (4.1 ± 0.4)E12 (6.2 ± 0.6)E11 5.9E13^b N(Mg II) . . . . . . . . . (0.9-1.6)E13 N(Si II) (1.6 ± 0.2)E12 (5.5 ± 0.5)E11 (1.0 ± 0.2)E11 (1.4 ± 0.1)E13 N(Fe II) . . . . . . . . . (9.4 ± 0.5)E11 N(C III) (3.7 ± 0.4)E14 6.9E13^b 3.0E13^b . . . N(N III) <∼ 2.5E13 <∼ 4.6E12 . . . . . . N(O III) (7.5 ± 2.0)E14 . . . . . . . . . N(Al III) . . . . . . . . . (7.4 ± 0.7)E11 N(Si III) (2.5 ± 0.2)E13 6.9E12^b 1.6E12^b (4.9 ± 1.0)E12 N(C IV) (1.2 ± 0.1)E14 (4.4 ± 0.5)E12 (9.5 ± 1.5)E12 (1.2 ± 0.1)E13 N(Si IV) (2.0 ± 0.2)E13 2.0 ± 0.2)E12 (1.1 ± 0.1)E12 (2.9 ± 0.3)E12 ⟨T ⟩, K 2.9E4 2.0E4 3.2E4 5.5E3 nH, cm^{−3} 9.0E–4 6.0E–3 7.0E–4 2.2E–2 L, kpc 90 4 280 0.004 N(He II) 7.4E18^b 4.3E18^b 2.0E19^b 2.0E16^b η 150 ± 20 50 ± 5 140 ± 20 2 ± 2 τ^{He II}_{GP} (at 3 Ryd) 1.45 ± 0.2 0

aZ_X = N_X/N_H; [Z_X] = log(N_X/N_H) − log(N_X/N_H)_⊙ bcalculated using the velocity–density distributions estimated from hydrogen and metal profiles cactual abundance may be 0.2 dex higher — see the last paragraph in Sect. 3.1.1

Physical parameters estimated with the UVB from Fig. 4 are given in Table 1, Col. 5. Strong relative underabundance of iron (three times solar values for carbon, oxygen and silicon and only 0.8 for iron) can be considered as reliable since it was reproduced for all tried spectral shapes. Aluminium is slightly overabundant compared to C, O and Si (4 times solar), but the accuracy of this estimation is not high enough due to uncertainties in the recombination coefficients used in CLOUDY. As for magnesium, a spread of its abundance (4-7 solar) is explained by the saturation of Mg II λ2796 Å and possible contamination of Mg II λ2803 Å with a telluric line.

3.2. Absorption systems towards Q 1157+3143

Absorption spectrum of this quasar was obtained with Keck/HIRES. Details on the data reduction are given in

Kirkman & Tytler (1999). Additionally, this bright quasar was observed with HST/STIS to study He II Lyα absorption in the intergalactic matter (Reimers et al. 2005b).

3.2.1. Absorption system at z_{abs} = 2.944

This absorption system (Fig. 8) lies very close to the quasar (z_{em} = 2.97, Lyα forest starts at z = 2.999) and could be associated. However, Q 1157+3143 does not show proximity effect. On the contrary, the line density in its vicinity is unusually high (Ganguly et al. 2001). A set of ions detected in the z_{abs} = 2.944 system is also typical for an intergalactic absorber: associated systems are usually highly ionized and show pronounced lines of O VI, N V, and C IV along with weak C III, Si III, and S IV, whereas the system under study reveals C III and Si III lines stronger than C IV, Si IV, and no N V absorption. At the

8 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

Fig. 5. Same as Fig. 3 but for the z_{abs} = 2.739 system (HE 2347–4342). The zero radial velocity is fixed at z = 2.73914. The estimated physical parameters are listed in Table 1, Col. 3.

Fig. 6. Same as Fig. 3 but for the z_{abs} = 2.741 system (HE 2347–4342). The zero radial velocity is fixed at z = 2.74097. The estimated physical parameters are listed in Table 1, Col. 4.

expected position of the O VI λ1031 Å line only a weak absorption is seen (its identification as O VI is ambiguous since O VI λ1037 Å is blended).

From the H I continuum absorption in the observed spectrum the neutral hydrogen column density of this system (together with its neighbor at z_{abs} = 2.939) is estimated as (1.5 ± 0.2) × 10^{17} cm^{−2} . Such a high hydrogen content together with

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 9

Fig. 7. Same as Fig. 3 but for the z_{abs} = 1.796 system (HE 2347–4342). Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the dotted line in Fig. 4. The zero radial velocity is fixed at z = 1.7963. The estimated physical parameters are listed in Table 1, Col. 5. Synthetic profiles of Mg II are calculated for the abundance 2.5 × 10^{−4} (see text). Blends are indicated by tick marks.

rather weak intensities of the metal lines point to a very low metallicity of the absorbing gas which is another argument against the associated nature of the z_{abs} = 2.944 system.

Test calculations with the HM ionizing spectrum confirmed the metallicity of 0.001Z_⊙. However, with this spectrum the calculated intensity of the C III line in the range −70 < v < 70 km s^{−1} was significantly less than observed. Since the position of this line is in the Lyα forest, possible blends should be taken into account. We do not find any metal absorption contaminating the C III line. The only candidate for blending could be a hydrogen absorption at z_{abs} = 2.17. If we assume that observed profile is mainly caused by this hydrogen absorption, then the kinetic temperature of the gas estimated from the line width is T_{kin} ≤ 32000 K. This implies that the ionization parameter U is less than 0.02 (for metallicity [Z] < −1.5, since there are no metal lines detected at z_{abs} = 2.17) and the linear size of the putative H I absorber does not exceed 0.5 kpc. Such small cloud would hardly survive in the IGM. Another argument in favor of C III is the comparison with the Si III line: both lines have similar widths (F W HM = 40 km s^{−1} and 36.5 km s^{−1} ) and the same asymmetry. Thus, we can assume with high probability that the absorption at −70 < v < 70 km s^{−1} is indeed caused by C III from the z_{abs} = 2.944 system. In this case only a spectrum with a significant flux depression between 3 and 4 Ryd makes it possible to fit adequately all observed lines.

The reconstructed spectral shape of the UVB is shown in Fig. 9 by the dotted line, the corresponding physical parameters are given in Table 2, Col. 2, and the synthetic profiles are plotted by the solid lines in Fig. 8.

10 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

Fig. 8. Same as Fig. 3 but for the z_{abs} = 2.944 system towards Q 1157+3143. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the dotted line in Fig. 9. The zero radial velocity is fixed at z = 2.9444. The estimated physical parameters are listed in Table 2, Col. 2. Blends are indicated by tick marks.

Here we find again a spectrum similar to that from the z_{abs} = 2.9171 system (HE 0940–1050, Paper I): its shape reflects both the external (GP depression) and local effects (an enhanced emission peak at 3 Ryd and a sharp break at 4 Ryd) arising from the reprocession of the incident ionizing radiation by the absorbing cloud itself.

The He II Lyα opacity is estimated as τ^{He II}_{GP} = 2.5 ± 0.2. The predicted value for the He II column density is 8.5 × 10^{18} cm^{−2} which gives η = 85.

The ratio [Si/C] = 0.06, but as mentioned in Sect. 3.1.1 the actual value may be 0.2 dex higher: [Si/C] <∼ 0.26.

A significant relative underabundance of nitrogen, [N/C] < −0.3, is also worth noting for this system.

3.2.2. Absorption system at z_{abs} = 2.939

This system presents metal lines of both low (C II, Si II) and high (C IV, Si IV) ionization stages (Fig. 10). Lines O VI λλ1031, 1037 Å are blended with strong Lyα forest absorptions. The spectrum of HM turned out to be inconsistent with the observed line intensities, the adjusted spectral shape is shown in Fig. 9 by the short-dashed line. The corresponding physical parameters are given in Table 2, Col. 3, and the synthetic profiles are plotted by the solid lines in Fig. 10.

Although shifted by only Δz = 0.0045 (Δv = 344 km s^{−1} ) from the z_{abs} = 2.944 system, the present absorber reveals significantly different physical conditions: metallicity two order of magnitude higher along with a lower ionization parameter (higher gas density) and a very small (for an intergalactic absorber) linear size below 1 kpc.

The z_{abs} = 2.939 system has optical depth ≃ 1 in the He II Lyman continuum. Thus, the attenuation of the incident radiation is probably not very pronounced and the recovered spectral shape can represent in this case the external UVB. It is seen from Fig. 9 that spectrum is softer at E > 4 Ryd than the model spectrum of HM and has a more pronounced He II Lyα emission peak at E = 3 Ryd. This is probably a consequence of a high number density of clouds registered at z <∼ 3 along the sight line towards Q 1157+3143.

The predicted value of η = 45 ± 5 is two times lower than η in the z_{abs} = 2.944 system and reflects both the higher gas

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 11

Table 2. Physical parameters of the z_{abs} = 2.944, 2.939, and 2.875 metal absorbers towards Q 1157+3143 derived by the MCISS procedure with the recovered UV background spectra shown in Fig. 9. Column densities are given in cm^{−2}

Parameter^a z_{abs} = 2.944 z_{abs} = 2.939 z_{abs} = 2.875 (1) (2) (3) (4)

U0 1.6E–2 8.8E–3 6.9E–2 NH 1.4E20 8.3E18 2.4E20 σv, km s^{−1} 20.0 22.5 25.0 σy 0.6 0.6 0.5 ZC 3.0E–7 2.3E–5 1.1E–6 ZN <3.0E–8 <1.0E–6 . . . ZSi 4.7E–8 3.7E–6 1.6E–7 [ZC] −2.90 −1.02 −2.36 [ZN] < −3.3 < −1.8 . . . [ZSi] −2.84^d −0.94 −2.34^d N(H I) (1.1 ± 0.2)E17 1.2 ± 0.1)E16 (1.6 ± 0.4)E16 N(C II) (1.4 ± 0.2)E12 (9.0 ± 0.5)E12 (2.0 ± 0.3)E12 N(Si II) (2.5 ± 0.2)E11 (1.5 ± 0.2)E12 (1.8 ± 0.2)E11 N(C III) (3.7 ± 0.6)E13^b (1.8 ± 0.2)E14 (1.9 ± 0.2)E14 N(N III) < 5.8E12 <∼ 7.5E12 . . . N(Si III) (3.4 ± 0.4)E12^b 2.0E13^c 4.2E12^c N(C IV) (3.2 ± 0.8)E12 (1.1 ± 0.3)E13 (4.0 ± 0.4)E13 N(Si IV) (1.7 ± 0.3)E12 (8.0 ± 0.4)E12 (6.8 ± 0.5)E12 ⟨T ⟩, K 2.7E4 1.8E4 3.7E4 nH, cm^{−3} 2.0E–3 3.0E–3 4.0E–4 L, kpc 27 0.86 200 N(He II) 8.5E18^c 5.4E17^c 7.0E18^c η 85 ± 10 45 ± 5 440 ± 40 τ^{He II}_{GP} (at 3 Ryd) 2.5 ± 0.3 2.5-3

a Z_X = N_X/N_H; [Z_X] = log(N_X/N_H) − log(N_X/N_H)_⊙;^b partially blended; c calculated using the velocity–density distribution estimated from hydrogen and metal profiles dactual value may be 0.2 dex higher — see the last paragraph in Sect. 3.1.1

Fig. 9. Same as Fig. 4 but for the systems at z_{abs} = 2.944, 2.939, and 2.875 towards Q 1157+3143.

density and the ionizing background which is harder at E > 4 Ryd (see Fig. 9).

Noteworthy is again a very strong relative underabundance of nitrogen, [N/C] < −0.8.

3.2.3. Absorption system at z_{abs} = 2.875

Hydrogen and metal lines identified in this system are shown in Fig. 11. The C IV λ1548 Å line falls in a gap between echelle orders, N III λ989 Å and O VI λλ1031, 1037 Å are severely blended. Note an extremely weak Si II λ1260 Å line which is nevertheless very well detected owing to high S/N = 150 in this wavelength range.

Test calculations with the HM ionizing spectrum showed carbon content [C/H] = −2.3 associated with a very high relative overabundance of silicon, [Si/C] ≃ 0.8. The calculated intensity at the expected position of C III came significantly underestimated, but blending cannot be excluded (the only candidate — H I Lyα at z_{abs} = 2.115).

The hydrogen column density is not well defined because of high noise at the locations of Ly-7 λ926 Å and Ly-8 λ923 Å, but, in any case, it does not exceed 3 × 10^{16} cm^{−2} .

The obtained overabundance of silicon points to the ionizing spectrum much softer at E > 4 Ryd than the HM spectrum that we used. A chance that high [Si/C] arises from contribution of the hypothetical Pop III stars with masses M ≥ 100M_⊙ (pair-instability SNe) seems quite unprobable since such overabundance has never been observed even in the extremely metal-poor clouds with Z <∼ 0.001Z_⊙ (see Sect. 3.1.1). A soft spectrum can be produced either by the He II continuous absorption (both in the IGM and inside the cloud itself) or by the input of radiation from soft sources like stars. In the present case the first option is preferable taking into account the ob-

12 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

Fig. 10. Same as Fig. 3 but for the z_{abs} = 2.939 system towards Q 1157+3143. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the short-dashed line in Fig. 9. The zero radial velocity is fixed at z = 2.93987. The estimated physical parameters are listed in Table 2, Col. 3. Blends are indicated by tick marks.

Fig. 11. Same as Fig. 3 but for the z_{abs} = 2.875 system towards Q 1157+3143. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the long-dashed line in Fig. 9. The zero radial velocity is fixed at z = 2.87567. The estimated physical parameters are listed in Table 2, Col. 4. Blends are indicated by tick marks.

servational evidence of large amount of He II at z_{abs} ≃ 2.87 towards Q 1157+3143 (Reimers et al. 2005b), and a high value of the ionization parameter U (log(Si IV/Si II) ≃ 1.6) which supposes η > 150 (see Fig. 19) which assusmes, in turn, that the cloud is opaque in He II.

Unfortunately, high noise in the C II λ1334 Å profile and blending of Si III hamper the accurate reconstruction of the ionizing background. Calculations with the spectrum from the z_{abs} = 2.944 system lead to the silicon overabundance [Si/C] ≃ 0.2-0.3. Taking into account that the average spectrum gives [Si/C] by <∼ 0.2 dex lower than the real value, this translates

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 13

Fig. 12. Same as Fig. 3 but for the z_{abs} = 2.568 system towards HS 1700+6416. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the dotted line in Fig. 13. The zero radial velocity is fixed at z = 2.56826. The estimated physical parameters are listed in Table 3, Col. 2.

to [Si/C] ≈ 0.4 − 0.5 which is slightly higher than measured elsewhere (Sect. 3.1.1). A UVB with a lowered by 0.2 dex depression between 3 and 4 Ryd (Fig. 9, long-dashed line) gives [Si/C] ≃ 0 (and reproduces the observed line intensity at the position of C III). These two shapes constrain the acceptable range. The physical parameters obtained with the latter spectrum are listed in Table 2, Col. 4. The corresponding synthetic profiles are plotted by the solid lines in Fig. 11. The calculated column density of He II, N(He II) = 7.0 × 10^{18} cm^{−2} , supposes that the cloud is optically thick in the He II continuum and, thus, the restored spectral shape is again a superposition of the local and external effects.

The mean optical depth of He II Lyα, τ^{He II}_{GP} = 2.5-3, is comparable to τ^{He II}_{GP} = 2.09 ± 0.1 estimated at z_{abs} = 2.87 by Reimers et al. (2005b).

We note the extremely high value of η = 440 ± 40 which is reliably reproduced in all test runs in spite of uncertainties in both the neutral hydrogen content and the spectral shape of the ionizing radiation. This value can be explained by the softness of the effective ionizing radiation field and by the low gas density in the absorbing cloud (cf. with η = 150 at z_{abs} = 2.944 produced by the ionizing spectrum of similar softness).

3.3. Absorption systems towards HS 1700+6416

This one of the brightest known high redshift quasar was observed many times with many instruments, both ground- and satellite-based. Reimers et al. (1992) and Vogel & Reimers (1995) firstly reported on 7 strong metal absorption systems identified in its low-resolution combined optical and UV spectra. Later on, Davidsen et al. (1996) measured opacity of the intergalactic He II Lyα using far UV spectrum obtained with the HUT. Simcoe et al. (2002, 2006) studied physical conditions in the metal absorption systems using high-resolution Keck telescope data. A comprehensive analysis of both H I and He II (FUSE) spectra was performed by F06 and Fechner & Reimers (2006). For our reconstruction of the underlying UVB spectra we selected systems with many different ionic lines, that are in the ionization equilibrium and do not show self-shielding effects^2. Observational data stem from the Keck/HIRES (Δλ = 3150−9000 Å) and HST/STIS (Δλ = 1155−1700 Å) spectra. Details on data reduction are given in Simcoe et al. (2002) and Fechner et al. (2006b).

3.3.1. Absorption system at z_{abs} = 2.568

Hydrogen and metal lines identified in this system are shown in Fig. 12. Test calculations with the ionizing spectrum of HM revealed that the red wing of H I Lyα is inconsistent with the assumption of constant metallicity inside the absorber. In the following, the red wings of hydrogen lines are reconstructed from the density-velocity distributions derived from metal lines under the assumption of constant metallicity.

Calculations with the HM spectrum produced also strongly underestimated intensity of C III. Blending of C III seems rather unprobable since the line is weak, narrow and its asymmetric profile is similar to those of C IV and O VI. Thus the shape of the HM ionizing spectrum was modified. The result is shown in Fig. 13 by the dotted line. The corresponding physical parameters are given in Table 3, Col. 2, and the synthetic profiles are plotted by the solid lines in Fig. 12.

The mean optical depth of the intergalactic He II Lyα absorption decreases at redshift z_{abs} = 2.56 to the value τ^{He II}_{GP} =

2 Since metal systems towards HS 1700+6416 are well known, the reader may be interested in more details why other systems were not included in the UVB recovering procedure: z = 2.578 — two overlapping systems with different metallicities which cannot be clearly separated; z = 2.315 — probably a non-equilibrial system with overionized O VI, may be associated with an AGN/QSO close to the line of sight; z = 2.168 — the ratios Si IV/Si II ≃ 40 and Si IV/C IV ≃ 0.16 point out to a very soft UVB (cf. data for the z = 2.875 system in Table 2), however, uncertainties in C II and Si III (blending ?) and the absence of C III λ977 Å do not allow us to reconstruct the actual spectral shape; z = 1.724 — most metal lines are contaminated by the Lyα forest absorptions.

14 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

Table 3. Physical parameters of the z_{abs} = 2.568, 2.438, 2.433, 2.379, and 1.845 metal absorbers towards HS 1700+6416 derived by the MCISS procedure with the recovered UV background spectra shown in Fig. 13. Column densities are given in cm^{−2}

Parameter^a z_{abs} = 2.568 z_{abs} = 2.438 z_{abs} = 2.433 z_{abs} = 2.379 z_{abs} = 1.845 (1) (2) (3) (4) (5) (6)

U0 1.3E–1 1.8E–2 9.4E–3 1.1E–1 7.9E–3 NH 3.3E18 1.2E19 2.0E19 3.2E19 2.1E19 σv, km s^{−1} 20.5 17.0 23.0 27.0 35.0 σy 0.5 0.5 0.7 0.6 0.6 ZC 2.0E–5 9.2E–6 1.5E–5 2.8E–6 8.4E–5 ZN <∼ 3.0E–6 <∼ 2.0E–6 . . . . . . 1.7E–5 ZO 1.0E–4 . . . . . . 1.6E–5 2.5E–5 ZMg . . . . . . . . . . . . 2.5E–5 Z_{Al} . . . . . . . . . . . . 1.0E–6 ZSi 6.2E–6 1.8E–6 2.4E–6 8.4E–7 1.4E–5 [ZC ] −1.08 −1.42 −1.20 −1.94 −0.46 [ZN] <∼ − 1.3 <∼ − 1.5 . . . . . . −0.55 [ZO] −0.65 . . . . . . −1.52 −0.25 [ZMg ] . . . . . . . . . . . . −0.25 [Z_{Al}] . . . . . . . . . . . . −0.36 [ZSi] −0.75 −1.24 −1.12 −1.61 −0.36 N(H I) 2.5E14^b (3.6 ± 1.5)E15 (2.6 ± 1.0)E16 (2.4 ± 0.3)E15 2.5E16^b N(C II) (1.4 ± 0.2)E11 (1.3 ± 0.3)E12 (1.3 ± 0.2)E13 . . . 3.6E13^c N(Mg II) . . . . . . . . . . . . 2.2E12 N(Si II) . . . <∼ 3.0E11 (2.2 ± 0.2)E12 . . . (3.9 ± 0.2)E12 N(C III) (1.2 ± 0.2)E13 (6.7 ± 0.6)E13 (2.5 ± 0.3)E14 (2.3 ± 0.4)E13 . . . N(N III) . . . <∼ 1.4E13 . . . . . . . . . N(O III) . . . . . . . . . . . . 1.6E15^c N(Al III) . . . . . . . . . . . . (5.8 ± 0.6)E11 N(Si III) (4.2 ± 0.3)1E11 (5.0 ± 0.3)E12 (2.8 ± 0.2)E13 (6.7 ± 0.3)E11 3.5E13^d N(C IV) (1.2 ± 0.1)E13 (2.5 ± 0.3)E13 (3.6 ± 0.2)E13 (1.6 ± 0.1)E13 (4.3 ± 0.2)E14 N(O IV) . . . . . . . . . . . . 1.8E15^c N(Si IV) (4.8 ± 0.4)E11 (4.0 ± 0.2)E12 (1.2 ± 0.1)E13 (5.3 ± 0.5)E11 (3.8 ± 0.3)E13 N(N V) . . . . . . . . . . . . (3.5 ± 0.3)E13 N(O VI) (3.9 ± 0.4)E13 . . . . . . (3.0 ± 0.3)E13 . . . ⟨T ⟩, K 3.3E4 2.6E4 2.1E4 4.3E4 1.5E4 nH, cm^{−3} 2.5E–4 1.5E–3 3.0E–3 3.0E–4 4.0E–3 L, kpc 4.0 3 2 38 2 N(He II) 2.6E16^c 3.7E17^c 1.1E18^c 2.9E17^c 3.5E17^c η 100 ± 10 100 ± 10 45 ± 5 120 ± 20 16 ± 5 τ^{He II}_{GP} (at 3 Ryd) 1.2 ± 0.2 1.2 ± 0.2 1.2 ± 0.2 0

a Z_X = N_X/N_H; [Z_X] = log(N_X/N_H) − log(N_X/N_H)_⊙;^b column density calculated from the velocity–density distribution estimated from metal profiles assuming constant metallicity within the absorber;^c calculated using the velocity and density distributions derived from hydrogen and metal profiles;^d partially blended

1.2 ± 0.2. Note again a significant underabundance of nitrogen, [N/C] < −0.3.

3.3.2. Absorption systems at z_{abs} = 2.438 and z_{abs} = 2.433

Both absorption systems (Figs. 14 and 15) are parts of a large absorption complex stretching over 1000 km s^{−1} (see Fig. 6 in Simcoe et el. 2006) and represent dense clumps embedded in a highly ionized gas traced by O VI. While this highly ionized gas could be still non-equilibrial, the systems under consideration have already reached the ionization equilibrium with the background radiation owing to their higher gas density and, hence, a shorter recombination time. Note that the whole absorbing complex resembles the z_{abs} = 1.8073 complex towards HS 0747+4259 described in Sect. 4.1 in Paper II.

From low-resolution spectrum, the neutral hydrogen column density of the whole complex is estimated as 4.0 × 10^{16} cm^{−2} (Vogel & Reimers, 1995). Test calculations with the HM ionizing spectrum resulted in an underestimated intensity of C II λ1334 Å along with a strong overestimation of Si II λ1193 Å. The adjusted spectral shape is shown in Fig. 13 by the shortdashed line. The calculated physical parameters are listed in Table 3, Cols. 3 and 4, and the corresponding synthetic profiles are shown by the solid lines in Figs. 14 and 15.

Although the spectral shape differs from that recovered for the z_{abs} = 2.568 system, the mean He II optical depth is the same: τ^{He II}_{GP} = 1.2 ± 0.2. This value is to be compared with τ^{He II}_{GP} = 1.0 ± 0.07 measured at z = 2.4 in the low resolution far UV spectrum of HS 1700+6416 by Davidsen et al. (1996), and with τ^{He II}_{GP} = 0.74 ± 0.34 at z = 2.45 measured from FUSE data by F06. It should be noted, however, that latter value

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 15

Fig. 14. Same as Fig. 3 but for the z_{abs} = 2.438 system towards HS 1700+6416. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the short-dashed line in Fig. 13. The zero radial velocity is fixed at z = 2.4386. The estimated physical parameters are listed in Table 3, Col. 3. Blends are indicated by tick marks.

Fig. 15. Same as Fig. 3 but for the z_{abs} = 2.433 system towards HS 1700+6416. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the short-dashed line in Fig. 13. The zero radial velocity is fixed at z = 2.4330. The estimated physical parameters are listed in Table 3, Col. 4.

can be underestimated due to problems with zero level flux in the FUSE spectrum (see Sect. 2 in F06).

Another point worth noting is the variation we find in η: η = 45 at z_{abs} = 2.433 and η = 100 at z_{abs} = 2.438 (Table 3), which occurs because of the density differences in the clouds under study.

The value of η at z_{abs} = 2.438 is close to the η estimated for the previous z_{abs} = 2.568 system although the gas density in these two absorbers is quite different. This result is a consequence of softer UVB at z_{abs} = 2.438 (see Fig. 19 in Sect. 4).

3.3.3. Absorption system at z_{abs} = 2.379

A set of metal lines observed in this system (Fig. 16) is identical to that from the z_{abs} = 2.568 absorber described in Sect. 3.3.1. Unfortunately, a noisy profile of C III hampers the accurate reconstruction of the spectral shape of the underlying radiation. Although this line lies deep in the Lyα forest, it is very narrow

(F W HM = 22.5 km s^{−1} ) and cannot be a hydrogen line. On the other hand, no metal candidate for possible blending was found. Thus, the observed absorption is with high probability due to C III. However, the spectrum of HM underestimates the observed intensity of C III far above the noise level, whereas the spectrum derived for the z_{abs} = 2.433 system underestimates Si III. At the same time, the spectral shape from z_{abs} = 2.568 system turned out to be quite consistent with all observed intensities. The physical parameters obtained with this UVB are given in Table 3, Col. 5 with the corresponding synthetic profiles shown by the solid lines in Fig. 16.

3.3.4. Absorption system at z_{abs} = 1.845

This system reveals one hydrogen line (Lyα) and a lot of metals in different ionic transitions (Fig. 17) which allow us to probe the underlying ionizing background. The column density of neutral hydrogen was estimated from low resolution spec-

16 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

Fig. 16. Same as Fig. 3 but for the z_{abs} = 2.379 system towards HS 1700+6416. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the dotted line in Fig. 13. The zero radial velocity is fixed at z = 2.3799. The estimated physical parameters are listed in Table 3, Col. 5.

Fig. 13. Same as Fig. 4 but for the systems at z_{abs} = 2.568, 2.433, 2.438, 2.379, and 1.845 towards HS 1700+6416.

trum by Vogel & Reimers (1995) as 5.6×10^{16} cm^{−2} , i.e. this system is optically thin in the hydrogen continuum. It is thin in the He II Lyman continuum as well: the attenuation of the incident radiation due to continuous He II absorption in the cloud itself leads to an increasing Si IV/C IV ratio, but we find in this system Si IV/C IV = 0.088 which is well below the values measured in the systems with local attenuations at z_{abs} = 2.735, 2.944, and 2.875 (Tables 1 and 2). Assuming optical depth in He II continuum below 1 one obtains from N(He II) = η·N(H I) < 5 × 10^{17} cm^{−2} the vlue of η ∼ 10 which assumes a low ionization parameter (high gas density) and a hard ionizing spectrum.

A hard ionizing continuum is also required by the presence of N V, otherwise we obtain [N/C] > 0. Such overabundance of nitrogen is predicted at high over solar metallicities by chemical evolution models (e.g. Hamann & Ferland 1999), but at Z ∼ Z_⊙ still deficit of nitrogen, [N/C] < 0, is measured (e.g. Srianand & Petitjean 2001; Reimers et al. 2005a; Jenkins et al. 2005). In principle, we cannot exclude a possibility that the present system is out of equilibrium and N V is still overionized (i.e. not in the ionization equilibrium with the background radiation). The O VI lines could clear up the actual physical conditions but they fall beyond the observable range. However, we do not observe any velocity shifts between the N V lines and all other ionic transitions which could indicate a multiphase nature of the absorbing gas. This makes ‘normal’ (equilibrium) conditions preferable.

Another very important clue to the physical properties of the absorbing gas deliver silicon ions: the observed ratios of Si IV/Si III ≃ 1 and Si IV/Si II ≃ 10 can be realized only at metallicities near solar values. As already explained in Sect. 3.1.2, this stems from a strong dependence of silicon ion fractions on the temperature which at high metallicities overrides dependence on the spectral shape of the UVB.

Taking together, these considerations allow us to design a possible shape of the ionizing continuum. It is shown in Fig. 13 by the long-dashed line with the derived physical parameters given in Table 3, Col. 6 and synthetic profiles plotted by the solid lines in Fig. 17. The red wing of a sole hydrogen line is inconsistent with the assumption of constant metallicity inside the absorber and we calculated it using the density–velocity distribution obtained from metal lines. As mentioned above, the available silicon lines require metallicity close to solar. However, with Z ≃ 0.5Z_⊙ we obtained N(H I) = 2.5 × 10^{16} cm^{−2} which is already half that estimated from the Lyman edge in low resolution spectrum. A possible explanation of this discrepancy may be that we observe a high metallicity (Z ∼ Z_⊙) blob with N(H I) ∼ (1-2)×10^{16} cm^{−2} embedded in a cloud or a chain of clouds with a joint column density N(H I) ∼ (3-4)×10^{16} cm^{−2} . To confirm this assumption, higher order H I Lyman series lines are needed.

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 17

Fig. 17. Same as Fig. 3 but for the z_{abs} = 1.845 system towards HS 1700+6416. Synthetic profiles (smooth curves) were calculated with the recovered ionizing spectrum shown by the long-dashed line in Fig. 13. The zero radial velocity is fixed at z = 1.8450. The estimated physical parameters are listed in Table 3, Col. 6. Blends are indicated by tick marks.

Because of this uncertainty of N(H I) in the metal-bearing cloud and unknown element ratios, the spectral shape plotted in Fig. 13 is not unique. However, it delivers quite reasonable and self-consistent physical parameters and, thus, can be considered as a plausible solution. In any case, the spectral indices α > −1.2 in the range 1 < E < 4 Ryd are favored since for lower indices one would obtain C/Si above solar which has never been observed and is not predicted theoretically.

Taking together, the high metallicity of the blob and hard ionizing spectrum allow to suggest the presence of a QSO/AGN close to the line of sight.

4. Discussion

The spectral shape of the background ionizing radiation in the energy range 1 < E < 10 Ryd is reconstructed from opticallythin metal absorption-line systems observed in QSO spectra at z ≈ 1.80 and 2.38 < z < 2.94. The spectral shape of the UVB does fluctuate, however these fluctuations are ruled by different sources at two considered redshift intervals.

In the range 2.38 < z < 2.94, the spectral shape is mostly affected by radiative transfer processes in the clumpy IGM involving absorption in both the He II Ly-α and Lyman continuum. We confirm our result from Paper I: the UVB at 2.4 < z_{abs} < 3.0 demonstrates the intensity depletion between 3 and 4 Ryd caused by the absorption of the He II Lyα photons in the IGM (He II Gunn-Petersen effect). None of the recovered

18 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

UVB shapes shows features which can be attributed to the contribution of radiation from soft sources like starburst galaxies. Such contribution would lead to a very steep slope at E > 1 Ryd (α < −2.0 at 1 < E < 3 Ryd) and reduced intensity at 3 Ryd (see Figs. 1 and 3 in Giroux & Shull, 1997) whereas the metal-line systems considered here require relatively hard (α > −1.6) spectral shapes with pronounced peaks at 3 Ryd combined with strong attenuation at E > 4 Ryd — features unambiguously related to the absorption in the He II Lyman continuum and subsequent re-emission of recombinant He II Ly-α.

From the depth of the GP trough in the recovered UVB spectra we can estimate the effective He II Lyα opacity of the IGM, τ^{He II}_{GP} . Fig. 18 shows the obtained redshift evolution of τ^{He II}_{GP} (filled symbols) together with the available directly measured He II Lyα opacities (open symbols) along different sightlines. The concordance between the recovered values and the direct measurements is good although our estimations are systematically higher by 20-40% (∼ 1-2σ). This difference can be explained by the following reasons. Firstly, the approximation of the continuum depression between 3 and 4 Ryd by a straight step does not take into account a winding shape of the actual GP trough. Secondly, the depth of this step is determined mostly from the analysis of carbon lines C II, C III, and C IV (see Sect. 2). However, the ionization potential of C III (3.52 Ryd) is close to the onset of the He II Lyβ forest (3.56 Ryd) and an additional GP absorption in He II Lyβ can affect the fraction of this ion and the subsequent C IV. These may lead to the overestimation of τ^{He II}_{GP} by 0.1–0.2 in our method. On the other hand, estimations of τ^{He II}_{GP} from FUSE data may give too small values due to problems in background subtraction at short wavelengths corresponding to z < 2.55 (see Sect. 2 in F06).

Analysis of the close absorption systems (z_{abs} = 2.735 and 2.739 towards HE 2347–4342 and z_{abs} = 2.433 and 2.438 towards HS 1700+6416) revealed two-three times fluctuations in η between them. These systems share the same UVB, and the fluctuations in η are caused entirely by the variations in the absorber gas density.

Now compare the z_{abs} = 2.433 and 1.845 systems. Both of them show similar U and n_H, but their η values differ by about 3 times (Table 3). In this case we observe the effect of different spectral softness (see Fig. 13).

Fig. 19 shows the dependence of η_{model} = Z_{He}Υ_{He II}/Υ_{H I} on the ionization parameter U calculated with CLOUDY for optically thin case assuming different ionizing spectra. In case of a constant gas density inside the absorber, η_{model} = η. When the gas density fluctuates within the absorber, η is defined as a density weighted mean of the η(U) values, thus being lower than η_{model} corresponding to the mean ionization parameter U_0 (see eqs.[24,25] in LAK). It is seen that in the range −3 < log(U) < −1 relevant for optically thin high redshift intergalactic absorbers the η_{model}-curve demonstrates a large gradient which becomes steeper with the softening of the UVB at E > 4 Ryd. Moreover, the interval of η_{model} values corresponding to −3 < log(U) < −1 also expands. Thus, in general, the scatter in the measured values of η can arise from the combined action of differences in the mean gas density between the absorbers and variable softness of the ionizing radiation due to absorption in the He II Lyman continuum. We can also predict that the scatter in η should decrease with decreasing z due to progressive hardening of the UVB spectrum.

Fig. 19 explains also the correlation between low H I column densities and high η values: weak absorbers tend to have lower gas densities and thus are shifted to the right part of the η(U) curve. This is also one of the reasons why η in voids are systematically higher than in the filaments: by definition, voids consist of weak H I absorbers. Another reason is a possible shielding of the UV radiation in voids by the surrounding clouds which can soften the ionizing spectra. This is illustrated by the z_{abs} = 2.735, 2.739 and 2.741 absorbers towards HE 2347–4342 located at the boundary of the void at 2.718 < z < 2.727 (Fig. 5 in Z04). These absorbers belong probably to the filamentary structure and form a layer with a linear size of ∼ 300 kpc^3. Table 2 from Z04 shows that the η values in the void at 2.718 < z < 2.727 are significantly higher than in the void at 2.816 < z < 2.823. The latter has no strong H I absorbers at its boundaries and lies close to the quasar HE 2347–4342, i.e. the UVB in this void can be quite hard. However, over large ranges in z the correlation “low N(H I) – high η” [N(H I) = 10^{12} − 10^{13} cm^{−2} ] should be weak due to superposition of UVBs with variable softness: harder UVBs give a significantly lower η especially for low gas density (and, in general, low column density) absorbers, thus effectively lowering the left side of the “N(H I) – η” distribution. As for stronger H I absorbers [N(H I) = 10^{13} − 10^{15} cm^{−2} ], they have usually higher gas densities (lower U values) and according to Fig. 19 their η values are less sensitive to the variations of UVB. Thus, the correlation “high N(H I) – low η” should hold over all redshifts. This is in concordance with direct measurements of η from the H I/He II Lyα forest in F06 (see their Fig. 10) and Fechner & Reimers (2006).

As for UVBs recovered at z ≃ 1.8, they are very hard at E > 3 Ryd — much harder than predicted by the HM model (Fig. 20). The reason for this discrepancy was already given in our Paper II: HM used a biased statistics of the Lyα clouds at z_{abs} <∼ 1.8 with too many strong Lyα absorbers leading to a significant underestimation of the UVB intensity at E > 3 Ryd. From the depth of the He II break at 4 Ryd we can calculate the effective He II column density which gives rise to this break (Table 4). It is seen that the values of N(He II) are spread by maximum 40% around the median 1.2×10^{18} cm^{−2} . Besides, the recovered ionizing spectra show a diversity of shapes with a tendency to high spectral indices at 1 < E < 4 Ryd (α > −1.4, median α = −1.0). These spectra are likely to be intrinsic spectra of quasars, i.e. not processed by the IGM. In order to cause a noticeable absorption in the He II Lyman continuum, the intervening absorbers should have N(He II) > 5 × 10^{17} cm^{−2} . According to Fig. 19, the corresponding lower limit on N(H I) will be 3.0×10^{15} cm^{−2} for the HM spectrum at z = 3 (middle curve) and 1.8×10^{15} cm^{−2} and

3 It is interesting to note that other absorbers from our study with characteristics similar to those of the complex at z = 2.735 − 2.741, namely the z_{abs} = 2.917 system towards HE 0940–1080 (Sect. 3.1, Paper I) and the z_{abs} = 2.875 system towards Q 1157+3143 (Sect. 3.2.3, present paper), also lie at the boundary of a void.

I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0 19

Fig. 18. Redshift dependence of the He II Lyα opacity, τ^{He II}_{GP} (z). Open symbols show direct measurements from HE 2347–4342 (Zheng et al. 2004), HS 1700+6416 (open square – Davidsen et al. 1996, crossed open square – Fechner et al. 2006a), and Q 1157+3143 (Reimers et al. 2005b). Filled symbols represent the values of τ^{He II}_{GP} estimated from the restored spectral shapes of the UVB ionizing radiation: diamond and reverse triangle — Paper I; triangles, squares and circles — the present paper. Error bars correspond to 1 σ confidence level.

5.5 × 10^{15} cm^{−2} for the softer and harder spectra (upper and lower curves, respectively). From statistics of the Lyα forest (e.g., Kim et al. 2002) it is well known that strong H I absorbers with N(H I) > 10^{15} cm^{−2} become more rare with decreasing redshift. This results in less absorption at the He II ionization edge leading to a harder UVB. To produce N(He II) > 5×10^{17} cm^{−2} , harder spectra, in turn, require more stronger H I absorbers which are even more rare. Thus, by z ≃ 1.8 a large part of the QSO/AGN emitted radiation remains unprocessed.

In support to this consideration the following observationbased arguments can be given. Using a combination of several hard X-ray surveys, Ueda et al. (2003) investigated cosmological evolution of the AGN luminosity function. They found that the comoving spatial density of most luminous AGNs (quasars) peaks at z ≃ 2 and after that decreases rapidly, but spatial density of less luminous but orders of magnitude more numerous AGNs continues to rise till z <∼ 1. On the other hand, a FUSE survey of the AGNs (z < 1) by Scott et al. (2004) shows that lower luminosity AGNs tend to have harder spectral slopes (median α = −0.6) in the range 650–1000 Å (0.9-1.4 Ryd).

Thus, we can conclude that a significant hardening of the UVB spectrum occurs between z = 2.38 and z = 1.80. According to Fig. 19, this hardening would result in decrease of η. The redshift evolution of η reported in Fechner & Reimers (2006) allows to suggest that hardening starts even earlier, somewhere at z ∼ 2.5. At the moment we cannot trace the UVB evolution between z = 2.5 and z = 1.80 because of scarcity of our absorbers in this redshift interval. This will be a topic of our future studies.

Fig. 19. Dependence of η_{model} on the ionization parameter U for different spectral shapes of the ionizing radiation: HM at z = 3 (solid line), and UVB restored at z = 2.93 (dotted line) and z = 1.80 (dashed line) which are, respectively, softer and harder than the HM spectrum. The UVB at z = 2.93 (Q 1157+3143) is shown in Fig. 9, and at z = 1.80 (HS 0747+4259) — in Fig. 20. The adopted metallicity is Z = 0.01Z⊙ .

5. Conclusions

1. Using the MCISS method based on realistic models of line formation in stochastic media and adequate computational technique, we restored the spectral shapes of the underlying ionizing radiation from optically thin metal-line systems. The UVB spectral shape does fluctuate in the redshift range studied, 1.8 < z < 2.94. However, the fluctuations at z <∼ 1.8 and 2.4 < z < 2.94 are ruled by different physical reasons. At 2.4 < z < 2.94, the fluctuations arise due to radiative transfer processes in the clumpy IGM, whereas at z <∼ 1.8 the IGM becomes almost transparent both in the H I and He II Lyman continua and the variability of spectral shapes comes from diversity of spectral indices of the intrinsic QSO/AGN spectra.

2. At 2.4 < z < 2.94, the recovered spectral shapes show the intensity depression between 3 and 4 Ryd which is interpreted as a manifestation of the He II Gunn-Peterson effect. The values of the mean He II Lyα opacity calculated from the depth of the recovered GP trough correspond well (within 1-2σ) to τ^{He II}_{GP} directly measured from the H I/He II Lyα forest towards the quasars studied. This concordance confirms the applicability of the MCISS procedure for studying He II absorption in the IGM.

3. The scatter of η = N(He II)/N(H I) and anti-correlation between N(H I) and η can be explained by the combined action of the spectral shape variability due to radiative transfer in the clumpy IGM and differences in the mean gas densities in the absorbing clouds. Progressive hardening of the recovered UVB towards lower z explains the correspond-

20 I. I. Agafonova et al.: UVB and He II absorption at 1.8 < z < 3.0

Fig. 20. The difference between the UVB predicted by HM at z = 1.8 (thick line) and those restored by the MCISS procedure (thin lines). The data are taken from (a) — the present paper, quasars HE 2347– 4342 and HS 1700+6416, (b) — Reimers et al. (2005a), quasar HE 0141–3932, (c) — Paper II, quasar HS 0747+4259, and (d) — Haardt & Madau (1996).

ing decrease of the median η-values reported in F06 and Z04.

4. All recovered UVBs are produced by QSO/AGN radiation

processed by the clumpy IGM and do not show features which can be attributed to the input of radiation from soft sources like starburst galaxies. The metal systems considered in the present paper and in Paper I have overdensities 10–100 implying that radiative transfer effects both in the cloud and in the IGM can be significant. This means that for regions with smaller overdensities the UVB should be harder in general. However, such regions (voids) can be bounded by filament structures optically thin in H I but thick in He II. In this case, the incident radiation is effectively shielded and the UVB in voids becomes softer.

Acknowledgements. The work of IDA and SAL is partly supported by the RFBR grant No. 06-02-16489 and by the Federal Agency for Science and Innovations (grant NSh 9879.2006.2). CF is supported by the DFG under RE 353/49-1. DT is supported in part by NSF grant AST 0507717 and NASA grants NAG5-13113 and HST-AR- 10688.01-A.

References

Agafonova, I. I., Centurión, M., Levshakov, S. A., & Molaro, P. 2005,

A&A, 441, 9 [Paper I] Asplund, M., Grevesse, N., & Sauval, A. J. 2004, astro-ph/0410214 Bolton, J. S., Haehnelt, M. G., Viel, M., & Carswell, R. F. 2006,

MNRAS, 366, 1378 Cayrel, R., Depagne, E., Spite, M., et al. 2004, A&A, 416, 1117 Davidsen, A. F., Kriss, G. A., & Zheng, W. 1996, Nature, 380, 47 Erni, P., Richter, P., Ledoux, C., & Petitjean, P. 2006, A&A, 451, 19 Fardal, M. A., Giroux, M. L., & Shull, M. 1998, AJ, 115, 2206

Table 4. He II column densities estimated from the ionizing spectra shown in Fig. 20

Quasar z_{abs} τ^{He II}_c N(He II) (at 4 Ryd) (cm^{−2} )

HE 0141–3932 1.78 1.2 0.7E18 HS 0747+4259 1.80 2.0 1.3E18 1.59 1.8 1.2E18 HS 1700+6416 1.84 1.2 0.7E18 HE 2347–4342 1.79 2.2 1.4E18

Fechner, C., Reimers, D., Kriss, G. A. et al. 2006a, A&A, 455, 91 [F06] Fechner, C., Reimers, D., Songaila, A., et al. 2006b, A&A, 455, 73 Fechner, C., & Reimers, D. 2006, submitted Ferland, G. J. 1997, A Brief Introduction to Cloudy (Internal Rep., Lexington: Univ. Kentucky) Ganguly, R., Charlton, J. C., & Bond, N. A. 2001, ApJ, 553, L101 Giroux, M. L., & Shull, J. M. 1997, AJ, 113, 1505 Haardt, F., & Madau, P. 1996, ApJ, 461, 20 [HM] Hamann, F., & Ferland, G. 1999, ARA&A, 37, 487 Holweger, H. 2001, in Solar and Galactic Composition, ed. R. F.

Wimmer-Schweingruber, AIP Conf. Proc., 598, 23 Jenkins, E. B., Bowen, D. V., Tripp, T. M., & Sembach, K. R. 2005, ApJ, 623, 767 Kim, T.-S., Carswell, R. F., Cristiani, S., D’Odorico, S., & Giallongo, E. 2002, MNRAS, 335, 555 Kirkman, D., & Tytler, D. 1999, ApJ, 512, L5 Levshakov, S. A., Agafonova, I. I., Reimers, D., & Baade, R. 2003a, A&A, 404, 449 Levshakov, S. A., Agafonova, I. I., D’Odorico, S., Wolfe, A. M., & Dessauges-Zavadsky, M. 2003b, ApJ, 582, 596 Levshakov, S. A., Agafonova, I. I., Centurión, M., & Mazets, I. E.

2002, A&A, 383, 813 Levshakov, S. A., Agafonova, I. I., & Kegel, W. H. 2000, A&A, 360, 833 [LAK] Maselli, A., & Ferrara, A. 2005, MNRAS, 364, 1429 Morton, D. C. 2003, ApJS, 149, 205 Reimers, D., Agafonova, I. I., Levshakov, S. A., Hagen, H.-J., Fechner, C., Tytler, D., Kirkman, D., & Lopez, S. 2006, A&A, 449, 9 [Paper II] Reimers, D., Janknecht, E., Fechner, C., Agafonova, I. I., Levshakov, S. A., & Lopez, S. 2005a, A&A, 435, 17 Reimers, D., Fechner, C., Hagen, H.-J., Jakobsen, P., Tytler, D., & Kirkman, D. 2005b, A&A, 442, 63 Reimers, D., Vogel, S., Hagen, H.-J., et al. 1992, Nature, 360, 561 Scott, J. E., Kriss, G. A., Brotherton, M., Green, R. F., Hutchings, J., Shull, J. M., & Zheng W., 2004, ApJ, 615, 135 Shull, J. M., Tumlinson, J., Giroux, M. L., Kriss, G. A., & Reimers, D. 2004, ApJ, 600, 570 Simcoe, R. A., Sargent, W. L. W., Rauch, M., Becker, G. 2006, ApJ, 637, 648 Simcoe, R. A., Sargent, W. L. W., & Rauch, M. 2002, ApJ, 578, 737 Srianand, R., & Petitjean, P. 2001, A&A, 373, 816 Ueda, M., Akiyama, M., Ohta, K., & Miyaji, T. 2003, ApJ, 598, 886 Verner, D. A., Barthel, P. D., & Tytler, D. 1994, A&AS, 108, 287 Vogel, S., & Reimers, D. 1995, A&A, 294, 377 Zheng, W., Kriss, G. A., Deharveng, J.-M., et al. 2004, ApJ, 605, 631 [Z04]