arXiv:astro-ph/0603290v1 12 Mar 2006

First Detection of Na i D lines in High-Redshift Damped Lyman-α Systems^1

SOHEI KONDO^2, NAOTO KOBAYASHI^2, YOSUKE MINOWA^2, TAKUJI TSUJIMOTO^3, CHRISTOPHER W. CHURCHILL^4, NARUHISA TAKATO^5, MASANORI IYE^3, YUKIKO KAMATA^3, HIROSHI TERADA^5, TAE-SOO PYO^5, HIDEKI TAKAMI^5, YUTAKA HAYANO^5, TOMIO KANZAWA^5, D. SAINT-JACQUES^6, WOLFGANG GÄESSLER^7, SHIN OYA^5, KO NEDACHI^2, ALAN TOKUNAGA^8

ABSTRACT

A Near-infrared (1.18 − 1.35 μm) high-resolution spectrum of the gravitationally-lensed QSO APM 08279+5255 was obtained with the InfraRed Camera and Spectrograph mounted on the Subaru Telescope using the adaptive optics system. We detected strong Na i D λλ 5891, 5897 doublet absorption in high-redshift damped Lyα systems (DLAs) at z_{abs} = 1.062 and 1.181, confirming the presence of Na i, which was first reported for the rest-frame UV Na i λλ 3303.3, 3303.9 doublet by Petitjean et al. This is the first detection of Na i D absorption in a high-redshift (z > 1) DLA. In addition, we detected a new Na i component in the z_{abs} = 1.062 DLA and four new components in the z_{abs} = 1.181 DLA. Using an empirical relationship between Na i and H i column density, we found that all components have large H i column density (log N_{HI} [cm^{−2}] ≳ 20.3), so that each component is classified as DLA absorption. We also detected strong Na i D absorption associated with a Mg ii system at z_{abs} = 1.173. Because no other metal absorption lines were detected

2Institute of Astronomy, University of Tokyo, 2-21-1 Osawa, Mitaka, Tokyo, 181-0015, Japan; kondo@ioa.s.u-tokyo.ac.jp

3National Astronomical Observatory of Japan, 2-21-1 Osawa, Mitaka, Tokyo 181-8588, Japan.

4Department of Astronomy, New Mexico State University, 1320 Frenger Mall, Las Cruces, NM 88003-8001

5Subaru Telescope, National Astronomical Observatory of Japan, 650 North A’ohoku Place, Hilo, HI 96720.

6Groupe d’astrophysique, Université de Montréal, 2900 Boulevard Édouard-Montpetit, Montréal, QC H3T 1J4, Canada

7Max-Plank Institute für Astronomie, Königstuhl 17, 69117 Heidelberg, Germany

8Institute for Astronomy, University of Hawaii, 2680 Woodlawn Drive, Honolulu, HI 96822

– 2 –

in this system at the velocity of the Na i absorption in previously reported optical spectra (observed 3.6 years ago), we interpret this Na i absorption cloud probably appeared in the line of sight toward the QSO after the optical observation. This newly found cloud is likely to be a DLA based upon its large estimated H i column density. We found that the N_{NaI}/N_{CaII} ratios in these DLAs are systematically smaller than those observed in the Galaxy; they are more consistent with the ratios seen in the Large Magellanic Cloud. This is consistent with dust depletion generally being smaller in lower metallicity environments. However, all five clouds of the z_{abs} = 1.181 system have a high N_{NaI}/N_{CaII} ratio, which is characteristic of cold dense gas. We tentatively suggest that the host galaxy of this system may be the most significant contributor to the gravitational-lens toward APM 08279+5255.

Subject headings: galaxies: formation–gravitational lensing–intergalactic medium– quasars: absorption lines–quasars: individual (APM 08279+5255)

1. Introduction

Damped Lyα systems (DLAs) comprise a class of the QSO absorption line systems characterized by high H i column density greater than 2 × 10^{20} [cm^{−2}] (Wolfe et al. 1986). DLAs are one of the strongest probes to examine the evolution of metallicity and dust depletion in gaseous components of high redshift galaxies (e.g., Pettini 2004). Since there is a well-established correlation between N_{Na I} and N_{HI} (Ferlet et al. 1985; Bowen et al. 1995), Na i absorption, which has been observed extensively in the Galaxy, holds the potential to estimate N_{H I} for individual clouds in DLAs, which usually cannot be precisely measured because of heavy blending of H i absorption. Moreover, the column density ratio of Na i to Ca ii provides a useful indicator of the degree of dust depletion of ISM clouds (e.g., Welsh et al. 1990; Crawford 1992; Bertin et al. 1993; Sembach et al. 1994; Price et al. 2001; Crawford et al. 2002) because sodium is hardly depleted from gas onto dust, while calcium can be heavily depleted (Savage & Sembach 1996).

The main absorption lines of Na i are the optical λλ 5891, 5897 D doublet and the ultraviolet λλ 3303.3, 3303.9 doublet. Observations exploiting the Na i D doublet hold the greater promise for comprehensive studies using Na i due to two important advantages:

1Based on data collected at Subaru Telescope, which is operated by the National Astronomical Observatory of Japan.

– 3 –

(1) the oscillator strength of the Na i D transitions are ∼ 70 times greater than the Na i UV transitions (Morton 2003), and (2) Na i D absorption rarely overlaps with other metal absorption lines because the wavelengths of the Na i D doublet are significantly redder than most of other metal lines. Thus, Na i UV doublets can be detected only in the highest column density systems toward the brightest QSO. Weak Na i absorption systems are more likely to be detected with the Na i D doublet. However, observations of Na i D in high-redshift DLAs require near-infrared high resolution spectroscopy because the rest-frame optical wavelengths are redshifted into the near-infrared. The advent of high sensitivity and high resolution spectroscopy in the near-infrared with 8-meter class telescopes has enabled us to undertake such observations (e.g., Kobayashi et al. 2002, 2003, 2005).

As a first trial for detecting Na i D absorption lines at high redshift (z > 1), we observed the extremely bright z_{em} = 3.911 gravitationally-lensed QSO ”APM 08279+5255” (Irwin et al. 1998). There are two dominant gravitationally-lensed images, ”A” and ”B,” with a separation of 0.^{′′}38 and flux ratio of f_B /f_A = 0.77 (Ibata et al. 1999). A third faint image, ”C”, was also reported by Ibata et al. between A and B, with a separation of A - C = 0.^{′′}15 and flux ratio f_C /f_A = 0.18. Petitjean et al. (2000) reported probable faint Na i UV doublet absorption associated with the z_{abs} = 1.062 and 1.181 DLAs in optical HIRES (Vogt et al. 1994) spectra obtained by Ellison et al. (1999a,b). For both systems, Petitjean et al. concluded (1) log N_{HI} ∼ 21, (2) metallicity 0.3 − 1.0 Z_⊙, (3) dust-to-metal ratio about half that of the Galaxy, and (4) a temperature of ∼few hundred Kelvin.

In this paper, we present near-infrared 1.18 -1.35 μm spectra of APM 08279+5255 with a resolution of about 50 km s^{−1}. The spectra were obtained with the InfraRed Camera and Spectrograph (IRCS) using the adaptive optics (AO) system at the Japanese Subaru Telescope. The AO improved the FWHM of both images A and B such that the spectra of A and B were marginally separated. However, we combined the spectra of images A and B in order to maximize the signal-to-noise ratio and to compare our results with those by Petitjean et al. (2000). We will publish A-B separated spectra elsewhere. This paper is structured as follows: In §2, we describe the IRCS observations and data reduction of APM 08279+5255. In §3, we present the Na i D absorption lines and the fitting results for the z_{abs} = 1.062, 1.173, 1.181 systems. We discuss our results and conclusions in §4.

2. Observation & Data Reduction

Near-infrared 1.18-1.35 μm spectra of APM 08279+5255 were obtained on 2001 December 25 UT, during the scientific commissioning run of the IRCS instrument. IRCS is a cassegrain mounted 0.9-5.5 μm near-infrared camera and spectrograph (Tokunaga et al.

– 4 –

1998; Kobayashi et al. 2000) with an AO system (Takami et al. 2004) on the 8.2m Subaru Telescope (Iye et al. 2004) located on Mauna Kea, Hawaii.

The Subaru AO system uses a curvature wave front sensor with 36 control elements to compensate for a disturbed wavefront due to the earth’s atmosphere. For an R ∼ 11 wavefront reference star under excellent observing conditions, the AO provides a stellar image with a Strehl ratio of ∼ 0.04 and a FWHM of ∼ 0.^{′′}07 in the J-band (1.25 μm). The performance degrades with fainter reference stars. For these observations, we used APM 08279+5255 itself (R ∼ 15.6) as the wavefront reference star. We achieved a FWHM of 0.^{′′}2 in the J-band, which is much narrower than (0.^{′′}5−0.^{′′}6) for typical seeing conditions at the Subaru Telescope.

We used the cross-dispersed Echelle mode of the IRCS, which provides a spectral resolution of 15 km s^{−1} (λ/Δλ ∼ 20000) with a 0.^{′′}15 slit. The pixel scale is 0.^{′′}075 (∼ 7.5 km s^{−1}) per pixel across the slit and 0.^{′′}060 per pixel along the slilt. The entire J -band (1.18 − 1.35 μm) was covered simultaneously in one IRCS exposure, with the cross-disperser in order 5 and the echelle in orders 42-48. Although the FWHM of the images were good throughout the observing time (about 0.^{′′}2-0.^{′′}5 in the J-band), we used a wider slit (0.^{′′}6) to maximize throughput. Thus, the spectral resolution was determined by the average image size ∼ 0.^{′′}5, and the resulting spectral resolution was ∼ 50 km s^{−1} (λ/Δλ ∼ 6000) in the observed wavelength range.

The slit length was 3.^{′′}8, and the position angle was set to 32^∘ so that both the lensed images A and B are in the slit. The telescope pointing was nodded along the slit by about 2^{′′} for each 600s exposure for sky-background and dark subtraction. Because of the fine pixel scale needed for AO images and the high spectral resolution, it is impossible to reach the background limit in 600s exposures, which are required to be less than the time variation of the sky OH emission. Eight sets of data were obtained, resulting in a total exposure time of 9600s. Spectra of bright telluric standard stars (HD 92728: A0Vs) at similar air mass were obtained in a similar fashion.

All the data were reduced following standard procedures using the IRAF^2 noao.imred.echelle package, including sky subtraction (subtraction of two frames), flat-fielding (halogen lamp with an integrating sphere), and aperture extraction. Argon lamp spectra that were taken at the end of the observing night were used for vacuum wavelength calibration. A Heliocentric correction of 9.64 km s^{−1} was applied to the vacuum wavelength calibrated spectra.

2IRAF is distributed by the National Optical Astronomy Observatories, which are operated by the Association of Universities for Research in Astronomy, Inc., under cooperative agreement with the National Science Foundation.

– 5 –

3. Results

In Figure 1, we present the 1.18 − 1.35 μm spectrum of APM 08279+5255. The raw spectrum was smoothed with a 3 pixel (∼ 20 km s^{−1}) boxcar function for presentation. Na i D absorption lines from the z_{abs} = 1.062 and 1.181 DLAs are clearly seen. Several velocity components can be seen in the Na i D absorption lines from the z_{abs} = 1.181 DLA. Additionally Na i D absorption lines associated with the z_{abs} = 1.173 Mg ii system (Petitjean et al. 2000) are detected. This doublet absorption line was identified as Na i D lines because other metal lines of other absorption systems listed in Ellison et al. (1999a,b) cannot account for these two absorption features.

We fit Voigt profiles to the Na i D absorption features assuming the component velocities identified by Petitjean et al. (2000) from metal absorption lines in the optical spectra by Ellison et al. (1999a,b). The column density, Doppler width, and redshift of each component were evaluated using VPGUESS^3 and VPFIT^4 (Carswell et al. 1987). We fit two components for the z_{abs} = 1.062 system and five for the z_{abs} = 1.181 system. The absorption profiles are dominated by the instrument profile, which is almost identical to the Gaussian width FWHM ∼ 50 km s^{−1}.

For the z_{abs} = 1.173 system, there is no a priori information on velocity components unlike the other systems. Also, there are several adjacent hot pixels on the right side of the Na i 5897 absorption line, which makes the fitting with multi velocity components difficult. Those hot pixels were difficult to remove because of their proximity to the Na i absorption line (see the feature labeled with × mark in Figure 4). Because of the above reasons, we performed only one component VPFIT (almost equivalent to a simple Gaussian fitting) for this system. The hot pixel regions were ignored for the fitting. In view of the statistical noise that can be estimated by point-to-point fluctuations on the continuum, the single component fitting is almost satisfactory.

The fitting results are summarized in Table 1. Figures 2,3,4 show the velocity profiles and fitting results for the Na i D lines. Using atmospheric absorption lines in the object and standard spectra, we confirmed that the pixel shift along the dispersion direction was less than 1 pixel throughout the observing time. Therefore the systematic uncertainty of the velocity is less than 7.5 km s^{−1}. Although the column densities and the Doppler widths could

3VPGUESS is a graphical interface to VPFIT written by Jochen Liske, http://www.eso.org/~jliske/vpguess/

4VPFIT is a Voigt profile fitting package provided by Robert F. Carswell, http://www.ast.cam.ac.uk/~rfc/vpfit.html

– 6 –

not be directly determined because of insufficient instrumental spectral resolution, they can also be constrained by the doublet ratio [i.e., equivalent width ratio W (5891)/W (5897)]. As the doublet ratio approaches unity, uncertainty in column density increases because the column density and Doppler width become degenerate for a fixed equivalent width.

Because the physical distance (∼ 1 kpc) between A and B at z ∼ 1 is much larger than the typical spatial scale of Na i clouds in our Galaxy (a few tens to several thousands AU e.g., Price et al. 2001), the images A and B are most likely covered unequally. This introduces an additional systematic uncertainty in the inferred properties of the Na i clouds. An estimation of the systematic uncertainty depends on the saturation level of the Na i absorption lines in the A+B combined spectrum. It can range from ∼0.3 dex for a moderately saturated case to ∼ 1 dex for a heavily saturated case. The estimated systematic uncertainty for each component is shown in Table 1.

Because the resolution of the optical spectrum is higher than our near-infrared spectrum, the estimated redshift of each component by Petitjean et al. (2000) should be more accurate than ours. Hereafter, we use the velocities reported by Petitjean et al. (2000) for our discussion of each component, except for the newly identified components from our spectrum.

3.1. DLA at z_{abs} = 1.062

In this system, we found two Na i components at +53 and +108 km s^{−1}, which we identify as the components at +55 and +120 km s^{−1} by Petitjean et al. (2000). While Petitjean et al. found Na i component only at the +55 km s^{−1}, we newly identified Na i component at the +120 km s^{−1}. The estimated column densities are log N_{NaI} = 12.9 and 11.7, respectively. These are consistent with Petitjean et al., who detected the former component with the similar column density, but not the latter component to an upper-limit of log N_{NaI} < 12.8.

3.2. DLA at z_{abs} = 1.181

In this system, we found five Na i components. We identified the three components at −99, −75, and +48 km s^{−1} as the components at −105, −80, and +40 km s^{−1} reported by Petitjean et al. (2000). While Petitjean et al. found Na i component only at the −80 km s^{−1}, we newly identified Na i components at the −105, and +40 km s^{−1}. We identified further two new Na i components at +4, and +101 km s^{−1}, which were not identified in Petitjean et al

– 7 –

probably due to contamination by other absorption lines. The estimated column density of the −80 km s^{−1} component is log N_{NaI} = 12.5, which is not consistent with Petitjean et al. However, our evaluation of the column density of −80 km s^{−1} component is not so robust because Mg i λ2852 absorption associated with an Mg ii absorption system at z_{abs} = 3.502 (Kondo et al. in preparation) overlaps with the Na i D λ5891. The estimated column density of the −105 km s^{−1} component is log N_{NaI} = 12.0, which is consistent with the upper-limit of log N_{NaI} < 12.4 found by Petitjean et al.

3.3. Mg ii system at z_{abs} = 1.173

In this system, we found a Na i component at +204 km s^{−1}. Petitjean et al. (2000) did not find any metal absorption lines at this velocity. The detected Na i absorption line probably arises in a cloud that was previously not in front of the quasar at this velocity. We discuss the detail of this newly identified component in §4.2. We could not detect Na i absorption lines associated with the four components around 0 km s^{−1} reported by Petitjean et al., probably because of their low Na i column density.

4. Discussion

4.1. H i Column Densities of Each Velocity Component

Following Petitjean et al. (2000), we estimated N_{HI} for all components using the empirical relationship, log N_{HI} = 0.688 log N_{NaI} + 12.16 (11.6 < log N_{NaI} < 13.4) (Sembach et al. 1993; Diplas & Savage 1994; Bowen et al. 1995) established for the Galactic interstellar absorption clouds. In Table 2, we summarize our results for N_{HI}. While this empirical relationship does not hold for log N_{NaI} < 11 (Welty et al. 1994; Wakker & Mathis 2000; Wakker 2001) nor for log N_{NaI} > 12.9 (Ferlet et al. 1985), the column densities of all the detected components are within the appropriate range of this relationship. The estimated N_{HI} in various components, however, is subject to systematic uncertainties related to the following issues:

1. Low metallicity

It is likely that the column density ratio N_{NaI}/N_{HI} is in proportion to the metallicity. Vladilo et al. (1993) found that the column density ratio in the Large Magellanic Cloud (LMC) decreases in proportion to the metallicity (∼ 0.3 Z_⊙, Peimbert et al. 1974; Pagel et al. 1977). Because the metallicities of the z_{abs} = 1.062 and 1.181 DLAs are estimated

– 8 –

to be in the range of 0.3 − 1.0 Z_⊙ (Petitjean et al. 2000), it is appropriate to interpret the estimated N_{HI} in these systems as lower-limits.

2. Contamination from a metal absorption line of other redshift

We could not evaluate the reliable column density of the −80 km s^{−1} component in the z_{abs} = 1.181 system because Mg i λ2852 absorption associated with a strong Mg ii system at z_{abs} = 3.502 (Kondo et al. in preparation) is blended with the Na i D λ 5891 absorption. Assuming the correlation, log N_{MgI}/N_{MgII} = −0.73 log N_{MgII} + 7.6 (Churchill et al. 2003b) and the same Doppler width (b = 13.7 km s^{−1}) as the Mg ii absorption lines, we estimated the equivalent width of the Mg i λ2852 absorption. The H i column density of this component was estimated after removing this contamination from Mg i, and this introduced systematic uncertainty. Even after removing the contamination, there still is another large uncertainty, because the resultant doublet ratio of the Na i absorption lines is close to unity.

3. Coverage of gravitationally-lensed images A and B

As stated above, it is likely that the Na i clouds do not equally cover the gravitationallylensed images A and B. Thus, the estimated Na i column density is uncertain as described in §3. The estimated N_{HI} varies accordingly.

While Petitjean et al. (2000) suggested that there are 40 and 20 small clouds in the z_{abs} = 1.062, and 1.181 systems, respectively, our results show that there are at least 2 and 5 high column density clouds in each system. Most interestingly, we find that each cloud in the z_{abs} = 1.181 system has a H i column density that is classified as a DLA. This is the first indication of an absorber in which the individual clouds are each of such high column density. This is in contrast to the findings of Churchill et al. (2003a), who constrained the size of DLA clouds be less than 25 pc in the lensed QSO 0957+561A,B and inferred that only one of the clouds gave rise to the DLA H i column density. This would suggest that the z_{abs} = 1.181 DLA, having log N_{HI} ∼ 21.2, may be probing a very massive and large underlying structure (see, for example, Turnshek et al. 2004).

4.2. Detection of a New DLAs at z_{abs} = 1.173: Proper Motion of a cloud of a few 100 AU?

We detected a new component at +204 km s^{−1} associated with the z_{abs} = 1.173 Mg ii absorption system. Based upon scaling from the high Na i column density, this system is probably a DLA rather than a Lyman-limit Mg ii system (Petitjean et al. 2000). Therefore,

– 9 –

this system might contribute to the gravitational-lensing of the QSO, together with the other three DLAs, at z_{abs} = 1.062, 1.181, and 2.974, as suggested by Petitjean et al. Despite the large Na i column density, Petitjean et al. did not identify any metal lines for this velocity component in the optical Keck spectrum. Similarly, in a subsequent search, we also could not identify any Mg ii, Mg i, and Ca ii absorption lines for this component in the HIRES spectrum^5 (see Figure 4).

Because there is a time-span of 3.6 years between our observation and the optical observation in the local-frame, or ∼1.7 years in the rest-frame (z_{abs} = 1.173) considering the effect of cosmological time dilation by a factor of (1 + z_{abs})^{−1}, it is probable that the newly identified cloud appeared in the line of sight toward the QSO within that time-span. If the cloud is moving in a tangential direction in the sky with a velocity of ∼ 400 km s^{−1}, the travel distance is ∼ 200 AU in ∼1.7 years in the rest-frame. The assumed velocity is comparable to the combined velocity of the motion of cloud in high-redshift galaxies (∼ 50 to ∼ 260 km s^{−1}, Erb et al. 2003) and the proper motion of field galaxies which should be smaller than the typical velocity dispersion of the cluster of galaxies (e.g., between ∼ 500 and ∼ 1000 km s^{−1}, Gal & Lubin 2004). This sets the upper-limit of the cloud size and it is consistent with the size of the Na i clouds in the Galaxy, which ranges from a few to several thousands AU (e.g., Meyer et al. 1996; Meyer & Lauroesch 1999; Welty & Fitzpatrick 2001; Andrews et al. 2001; Lauroesch et. al. 2000, 2003). Our result shows that we can catch the very small-scale structures of the cold (∼ 100 K) neutral gas component in high-z QSO absorption systems with time variation of Na i absorption features. The observable spatial scale with this technique is much smaller than that with the observation of gravitationally-lensed QSOs (see discussion in Ellison et al. 2004).

4.3. Dust Depletion and Chemical Uniformity in DLAs

The column density ratio N_{NaI}/N_{CaII} has often been used as a good indicator of the degree of dust depletion because sodium is hardly depleted from gas onto dust grains while calcium can be heavily depleted (Savage & Sembach 1996). In Table 3, we list the ratio N_{NaI}/N_{CaII} of each component. N_{CaII} for the +120 km s^{−1} component at z_{abs} = 1.062 and for the −105 and −80 km s^{−1} components at z_{abs} = 1.181 are taken from Petitjean et al. (2000), while those for the +4, +40, and +101 km s^{−1} components at z_{abs} = 1.181 were

5ftp://ftp.ast.cam.ac.uk/pub/papers/APM08279

– 10 –

evaluated^6 using archived optical spectra (Ellison et al. 1999a,b).

We estimated the 3σ upper-limit of N_{CaII} for the +4, and +101 km s^{−1} components at z_{abs} = 1.181, because no Ca ii absorption line was detected in the optical spectra. In Figure 4, we show a log [N_{NaI}/N_{CaII}] – log N_{NaI} plot for the DLAs as well as Na i clouds in the Galaxy (Vallerga et al. 1993) and in the LMC (Vladilo et al. 1993).

We found that log [N_{NaI}/N_{CaII}] in these DLAs is systematically smaller than those in the Galaxy but similar to those in the LMC (Welty et al. 1999), suggesting that dust depletion is generally smaller in a lower metallicity environment. Our results are consistent with the results of Vladilo (1998), who shown that dust-to-metal ratios of DLAs are similar to that of the LMC but smaller than that of the Galaxy, using the column density ratio of zinc to chromium.

It is also interesting to consider the uniformity in the N_{NaI}/N_{CaII} ratio across the ∼ 200 km s^{−1} velocity spread of the z_{abs} = 1.181 DLA. As presented in Table 3, it would appear that the ratios are consistent with being uniform with component velocity, though there is large uncertainty in this statement. If so, this is consistent with the findings of Prochaska (2003a) and Churchill et al. (2003a), who reported uniform column density ratios as a function of velocity in DLAs. It is also found by Churchill et al. that the uniformity is spatial, at least on the scale of 200 pc. If the N_{NaI}/N_{CaII} ratio is more–or–less constant across the profiles in the z_{abs} = 1.181 DLA, it would suggest that the chemical, ionization, and dust depletion levels are uniform across the clouds.

4.4. The z_{abs} = 1.181 System: Cold Dense Gas Clouds near the Center of a Galaxy ?

All five components of the z_{abs} = 1.181 system have log [N_{NaI}/N_{CaII}] > 0, which is a characteristic of cold dense gas in the Galaxy (known as the “the Routly-Spitzer effect”, e.g., Routly & Spitzer 1952; Vallerga et al. 1993; Sembach et al. 1994). Because there are five cold dense and very high column density clouds for the z_{abs} = 1.181 system, we suggest that the line of sight may be passing near the center of the host galaxy. The relatively high metallicity of this system (0.3−1.0 Z_⊙, Petitjean et al. 2000) compared to that typical of z∼1 DLAs (∼ 0.1 Z_⊙, Prochaska et al. 2003b) also supports the above idea, because the metallicity

6We evaluated Ca ii column density for those systems using VPFIT. We evaluated Ca ii column densities also for the +120 km s^{−1} component at z_{abs} = 1.062 and the −105, and −80 km s^{−1} components at z_{abs} = 1.181 and confirmed that our fitting results are consistent with those estimated by Petitjean et al. (2000).

– 11 –

of DLA absorption is higher in the inner region galaxies because of a metallicity gradient (Chen et al. 2005). Therefore, the host galaxy of this system might be the most significant contributor to the gravitational-lens among four DLAs toward APM 08279+5255. Note that some DLAs were observed to have an impact parameter larger than 65 kpc (Churchill et al. 2005) and above argument should be taken with caution.

We are grateful to all of the IRCS and AO team members and the Subaru Telescope observing staffs for their efforts, which made it possible to obtain these data. We are also grateful to Ellison et al. for making their excellent data available in the Internet and to Jochen Liske for kindly answering our questions about VPGUESS. We thank the National Astronomical Observatory of Japan for their financial support and encouragement for the construction of the IRCS and AO. Y.M. is financially supported by the Japan Society for the Promotion of Science (JSPS).

REFERENCES Andrews, S. M., Meyer, D. M., & Lauroesch, J. T. 2001, ApJ, 552, L73 Bowen, D. V., Blades, J. C., & Pettini, M. 1995, ApJ, 448, 634 Bertin, P., Lallement, R., Ferlet, R., & Vidal-Madjar, A. 1993, A&A, 278, 549 Carswell, R. F., Webb, J. K., Baldwin, J. A., & Atwood, B. 1987, ApJ, 319, 709 Crawford, I. A. 1992, MNRAS, 259, 47 Crawford, I. A., Lallement, R., Price, R. J., Sfeir, D. M., Wakker, B. P., & Welsh. B. Y.

2002, MNRAS, 337, 720 Chen, H.-W., Kennicutt, R. C., Jr., & Rauch, M. 2005, ApJ, 620, 703 Churchill, C. W., Mellon, R. R., Charlton, J. C., & Vogt, S. S. 2003a, ApJ, 593, 203 Churchill, C. W., Vogt, S. S., & Charlton, J. C. 2003b, AJ, 125, 98 Churchill, C. W., Kacprzak, G. G., & Steidel, C. C. 2005, IAU Colloq. 199: Probing Galaxies through Quasar Absorption Lines, 24 Diplas, A., & Savage, B. D. 1994, ApJS, 93, 211 Ellison, S. L., Lewis, G. F., Pettini, M., Chaffee, F. H., & Irwin, M. J. 1999a, ApJ, 520, 456

– 12 –

Ellison, S. L., et al. 1999b, PASP, 111, 946 Ellison, S. L., Ibata, R., Pettini, M., Aracil, B., Petitjean, P., Srianand, R. 2004, A&A, 441, 79 Erb, D. K., Shapley, A. E., Steidel, C. C., Pettini, M., Adelberger, K. L., Hunt, M. P., Moorwood, A. F. M., & Cuby, J. 2003, ApJ, 591, 101 Ferlet, R., Vidal-Madjar, A., & Gry, C. 1985, ApJ, 298, 838 Gal, R. R., & Lubin, L. M. 2004, ApJ, 607, L1 Ibata, R. A., Lewis, G. F., Irwin, M. J., Leha’r, J., & Totten, E. J. 1999, AJ, 118, 1922 Irwin, M. J., Ibata, R. A., Lewis, G. F., & Totten, E. J. 1998, ApJ, 505, 529 Iye, M., et al. 2004, PASJ, 56, 381.

Kobayashi, N., et al. 2000, Proc. SPIE, 4008, 1056 Kobayashi, N., Terada, H., Goto, M., & Tokunaga, A. 2002, ApJ, 569, 676 Kobayashi, N. 2003, in ”The IGM/Galaxy Connection”, J.L. Rosenberg and M.E. Putman (eds.), Kluwer Academic Publishers., 249 Kobayashi, N., Tsujimoto, T. & Minowa, Y. 2005, in ”Science with Adaptive Optics”, W.

Brandner & M. Kasper (eds.), Springer, 352 Lauroesch, J. T., Meyer, D. M., & Blades, J. C. 2000, ApJ, 543, L43 Lauroesch, J. T., & Meyer, D. M. 2003, ApJ, 591, L123 Lord, S. D. 1992, NASA Technical Memo (Washington: NASA), 103957 Meyer, D. M., & Blades, J. C. 1996, ApJ, 464, L179 Meyer, D. M., & Lauroesch, J. T. 1999, ApJ, 520, L103 Morton, D. C. 2003, ApJS, 149, 205 Pagel, B. E. J, Edmunds, M. G., Fosbury, R. A. E., & Webster, B. L. 1978, MNRAS, 184, 569 Peimbert, M., & Torres-Peimbert, S. 1974, ApJ, 193, 327 Petitjean, P., Aracil, B., Srianand, R., & Ibata, R. 2000, A&A, 359, 457

– 13 –

Pettini, M. 2004, in Cosmochemistry: The Melting Pot of the Elements, ed. C. Esteban et al. (Cambridge: Cambridge Univ. Press), 257 Price, R. J., Crawford, I. A., Barlow, M. J., & Howarth, I. D. 2001, MNRAS, 328, 555 Prochaska, J. X. 2003a, ApJ, 582, 49 Prochaska, J. X., Gawiser, E., Wolfe, A. M., Castro, S., & Djorgovski, S. G. 2003b, ApJ, 595, L9 Routly, P. M., & Spitzer, L. 1952, ApJ, 115, 227 Savage, B. D., & Sembach, K. R. 1996, ARA&A, 34, 279 Sembach, K. R., Danks, A. C., & Savage, B. D. 1993, A&AS, 100, 107 Sembach, K. R., & Danks, A. C. 1994, ApJ, 289, 539 Takami, H., et al. 2004, PASJ, 56, 225 Tokunaga, A. T., et al. 1998, Proc. SPIE, 3354, 512 Turnshek, D. A., Rao, S. M., Nestor, D. B., Vanden Berk, D., Belfot-Mihalyi, M., & Monier, E. M. 2004, ApJ, 609, L53 Vladilo, G., Molaro, P., Monai, S., D’Odorico, S., Ferlet, R., Vidal-Madjar, A., & Dennefeld, M. 1993, A&A, 273, 37 Vladilo, G. 1998, ApJ, 493, 583 Vallerga, J. V., Vedder, P. W., & Welsh, B. Y. 1993, ApJ, 411, 729 Vogt, S. S., et al. 1994, in Proc. SPIE, 2128, 326 Wakker, B. P., & Mathis, J. S. 2000, ApJ, 544, L107 Wakker, B. P. 2001, ApJS, 136, 463 Welsh, B. Y., Vedder, P. W., & Vallerga, J. V. 1990, ApJ, 358, 473 Welty, D. E., Hobbs, L. M., & Kulkarny, V. P. 1994, ApJ, 436, 152 Welty, D. E., Frisch, P. C., Sonneborn. G., & York, D. G. 1999, ApJ, 512, 636 Welty, D. E., & Fitzpatrick, E. L. 2001, ApJ, 551, L175

– 14 –

Wolfe, A. M., Turnshek, D. A., Smith, H. E., & Cohen, R. D. 1986, ApJS, 61, 249

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 15 –

Fig. 1.— Detected Na i D absorption lines at z_{abs} = 1.062 (left panel) and z_{abs} = 1.173, 1.181 (right panel). Vertical axis is normalized flux to the continuum level and horizontal axis is local-frame wavelength in both panels. The spectrum was smoothed with a 3 pixel (∼ 20 km s^{−1}) boxcar function. Longer lines indicate Na i D λ5891, while shorter lines indicate Na i D λ5897. The left spectrum is noisier than the right one because the Na i D absorption lines at z_{abs} = 1.062 were located on the edge of the detector where the detector noise is significantly larger. The bottom panel shows the telluric absorption spectrum calculated with ATRAN package software (Lord 1992).

– 16 –

Fig. 2.— Velocity profile of metal lines in z_{abs} = 1.062 system. Horizontal axis shows the heliocentric velocity from z=1.06230. Vertical axis is normalized flux to the continuum level. Top two panels show the velocity profiles of Na i D λλ5891, 5897 absorption lines obtained with IRCS with the velocity resolution of ∼ 50 km s^{−1}. Bottom four panels show the velocity profile of Na i λ3303.9, Ca ii λ3934, Mg ii, λ2803 and Ti ii λ3242 absorption lines obtained with HIRES with the velocity resolution of ∼ 8 km s^{−1}. Vertical dashed lines mark the velocity components found by Petitjean et al. (2000). The blue line shows the Na i velocity component which has been detected with Na i λλ3303.3, 3303.9 (Petitjean et al. 2000) and the red line shows the newly detected Na i velocity component determined from the VPFIT program, which was also seen in the Ca ii, Mg ii, and Ti ii line profiles. Gray lines show the sum of all components. In the HIRES spectra, unmarked absorption lines are either from telluric absorption or other unrelated systems.

– 17 –

Fig. 3.— Velocity profile of metal lines in the z_{abs} = 1.18 system. Notations are same as those in Figure 2. The horizontal axis shows the heliocentric velocity from z=1.1807. Bottom four panels show the velocity profile of Na i λ3303.9, Ca ii λ3934, Mg ii λ2803 and Mg i λ2825 absorption lines obtained with HIRES. Vertical dashed lines mark velocity components (V = −105, −80, +40 km s^{−1}) found by Petitjean et al. (2000) and those (V = +4, +101 km s^{−1}) newly found with Na i D data.

– 18 –

Fig. 4.— Velocity profile of metal lines form z_{abs} = 1.173 system. Notation are same as those in Figure 2. Horizontal axis shows the heliocentric velocity from z=1.1727. Bottom three panels show the velocity profiles of Ca ii λ3934, Mg ii λ2803 and Mg i λ2852 absorption lines obtained with HIRES. Vertical dashed lines mark velocity components (V = −20, 0, +35, +50 km s^{−1}) found by Petitjean et al. (2000) and those (V = +204 km s^{−1}) newly found with Na i D data. Spurious features labeled with × mark on the right side of λ5897 absorption are due to hot pixels. See the main text for detail.

– 19 –

Fig. 5.— The relation of log N_{NaI} and log [N_{NaI}/N_{CaII}]. Red points show our DLA data for z_{abs} = 1.181. A red circle shows our DLA data for z_{abs} = 1.062. Black and blue points show the data for our Galaxy (Vallerga et al. 1993) and the LMC (Vladilo et al. 1993) , respectively. The uncertainty of those data is less than 20%. Red filled square shows the data for the V = −80 km s^{−1} velocity component at z_{abs} = 1.181, whose uncertainty is not shown because it could not be accurately estimated due to the accidental overlap of the z_{abs} = 3.502 Mg i absorption line (see main text).

– 20 –

Table 1. The velocity components of the detected Na i D absorption lines

Our results Petitjean et al. (2000) system z_{abs} V^{a,b} log N_{NaI} b V^{a,c} log N_{NaI} b (km s^{−1}) (km s^{−1}) (km s^{−1}) (km s^{−1})

1.062 1.06266±0.00001 +53±2 12.9^d ±1.6 1.1±0.7 +55 12.9 1.5 1.062 1.06305±0.00002 +108±3 11.7^e ±0.1 7±12 +120 < 12.8 1.5 1.173 1.17418±0.00001 +204±1 12.3^d ±0.6 1.0±0.4 · · · · · · · · · 1.181 1.17998±0.00006 -99±8 12.0^d ±0.5 1.3±2 -105 < 12.4 2.5 1.181 1.18015±0.00003 -75±4 12.5^f ±0.1 4±2 -80 13.5 0.8 1.181 1.18073±0.00005 +4±6 11.7^f ±0.5 0.8±1 · · · · · · · · · 1.181 1.18105±0.00003 +48±4 12.0^e ±0.1 3.6±3 +40 · · · · · · 1.181 1.18143±0.00002 +101±2 12.2^e ±0.2 1.8±0.6 · · · · · · · · ·

aThe velocity zero point is set to z=1.06230, 1.17270, 1.18070 for each system.

bThere is a systematic uncertainty which is less than ∼ 7.5 km s^{−1}. See main text for detail.

cWe estimated the velocity with an accuracy of 5 km s^{−1} from Figure 7,8 of Petitjean et al. (2000) by eyes because Petitjean et al. (2000) do not list the velocities.

dThere is a systematic uncertainty of about 1 dex because the gravitationally-lensed images are not resolved. See main text for detail.

eThere is an additional systematic uncertainty of about 0.3 dex because the gravitationally-lensed images are not resolved. See main text for detail.

f There is a possible significant systematic uncertainty because of the accidental overlap of the z_{abs} = 3.502 Mg i absorption line. See main text for detail.

– 21 –

Table 2. Estimated N_{HI} for the Na i D absorption lines

Our results Petitjean et al. (2000) system V log N_{NaI} log N_{HI} log N_{NaI} log N_{HI}

1.062 +55^a 12.9^b ±1.6 21.0^b ±1.1 12.91 ± 0.04 21.0 ± 0.0 1.062 +120^a 11.6^c ±0.1 20.2^c ±0.1 < 12.8 < 21.0 1.173 +204 12.3^b ±0.6 20.6^b ±0.4 · · · · · · 1.181 -105^a 12.0^b ±0.5 20.4^b ±0.3 < 12.40 < 20.7 1.181 -80^a 12.9^d 20.7^d 13.5 ± 0.11 21.4 ± 0.1 1.181 +4 11.7^c ±0.5 20.2^c ±0.3 · · · · · · 1.181 +40^a 12.0^c ±0.1 20.4^c ±0.1 · · · · · · 1.181 +101 12.2^c ±0.2 20.5^c ±0.1 · · · · · ·

aVelocities from figures in Petitjean et al. (2000). See note b in Table 1 for detail.

bThere is an additional systematic uncertainty of about 1 dex. See Table 1.

cThere is an additional systematic uncertainty of about 0.3 dex. See Table 1.

dThere is a possible significant systematic uncertainty. The value shown here is after removing of the contamination from the Mg i absorption at z_{abs} = 3.502.

– 22 –

Table 3. Comparison of log N_{NaI} and log [N_{NaI}/N_{CaII}] for the Na i D absorption lines

system V log N_{NaI} log N_{CaII} log [N_{NaI}/N_{CaII}]

1.062 +50 12.9^a ±1.6 · · ·^d · · ·^d 1.062 +110 11.7^b ±0.1 11.73 ± 0.03 −0.02 ± 0.1 1.181 -100 12.0^a ±0.5 11.33 ± 0.39 0.7 ± 0.6 1.181 -75 12.9^c 11.79 ± 0.35 1.1 1.181 +4 11.7^b ±0.5 < 11 > 0.7 1.181 +40 12.0^b ±0.1 11.4 ± 0.2 0.6 ± 0.1 1.181 +101 12.2^b ±0.2 < 11 > 1.2

aThere is an additional systematic uncertainty of about 1 dex. See Table 1.

bThere is an additional systematic uncertainty of about 0.3 dex. See Table 1.

cThere is a possibly significant systematic uncertainty. The value shown here is after removing the contamination from the Mg i absorption at z_{abs} = 3.502.

dNo measurement was possible due to the blending effects. See the note of TABLE 2 in Petitjean et al. (2000).