arXiv:astro-ph/0509649v1 21 Sep 2005

Accepted AJ, 2005 Sep 21

Preprint typeset using L^ATEX style emulateapj v. 04/03/99

SPITZER 70μm AND 160μm OBSERVATIONS OF THE EXTRAGALACTIC FIRST LOOK SURVEY

D. T. Frayer^1, D. Fadda^1, L. Yan^1, F. R. Marleau^1, P. I. Choi^1, G. Helou^1, B. T. Soifer^1, P. N. Appleton^1, L. Armus^1, R. Beck^1, H. Dole^2, C. W. Engelbracht^3, F. Fang^1, K. D. Gordon^3, I. Heinrichsen^1, D. Henderson^1, T. Hesselroth^1, M. Im^4, D. M. Kelly^3, M.

Lacy^1, S. Laine^1, W. B. Latter^1, W. Mahoney^1, D. Makovoz^1 , F. J. Masci^1, J. E. Morrison^3, M. Moshir^1, A. Noriega-Crespo^1, D. L. Padgett^1, M. Pesenson^1, D. L.

Shupe^1, G. K. Squires^1, L. J. Storrie-Lombardi^1, J. A. Surace^1, H. I. Teplitz^1, G. Wilson^1 Accepted AJ, 2005 Sep 21

ABSTRACT We present Spitzer 70μm and 160μm observations of the Spitzer extragalactic First Look Survey (xFLS). The data reduction techniques and the methods for producing co-added mosaics and source catalogs are discussed. Currently, 26% of the 70μm sample and 49% of the 160μm-selected sources have redshifts. The majority of sources with redshifts are star-forming galaxies at z < 0.5, while about 5% have infrared colors consistent with AGN. The observed infrared colors agree with the spectral energy distribution (SEDs) of local galaxies previously determined from IRAS and ISO data. The average 160μm/70μm color temperature for the dust is T_d ≃ 30 ± 5 K, and the average 70μm/24μm spectral index is α ≃ 2.4 ± 0.4. The observed infrared to radio correlation varies with redshift as expected out to z ∼ 1 based on the SEDs of local galaxies. The xFLS number counts at 70μm and 160μm are consistent within uncertainties with the models of galaxy evolution, but there are indications that the current models may require slight modifications. Deeper 70μm observations are needed to constrain the models, and redshifts for the faint sources are required to measure the evolution of the infrared luminosity function.

Subject headings: galaxies: evolution — galaxies: starburst — infrared: galaxies

1. INTRODUCTION

One of the first science observations carried out with the Spitzer Space Telescope (Werner et al. 2004) was the nonproprietary extragalactic First Look Survey (xFLS) which was designed to characterize the infrared sky at previously unexplored sensitivities. The IRAS mission first uncovered the presence of infrared luminous galaxies in the local universe (Neugebauer et al. 1984; Soifer et al. 1987), and the ISO infrared (Elbaz et al. 1999, 2002; Rodighiero et al. 2005) and ground-based submillimeter and millimeter observations (Blain et al. 2002 and references therein) have highlighted the importance that infrared luminous galaxies have on the general understanding of galaxy evolution. Since the cosmic infrared background (CIB) peaks in the far-infrared (FIR) (Hauser & Dwek 2001), studying the properties of galaxies that are bright in the FIR is crucial for constraining models of galaxy evolution.

In this paper, we present 70μm and 160μm observations of the xFLS field using the Multiband Imaging Photometer for Spitzer (MIPS, Rieke et al. 2004). The xFLS is a 4 deg^2 survey. The SWIRE Spitzer survey (Londsdale et al. 2004) covers a wider area (49 deg^2) to similar depths, and deeper observations covering smaller areas are being taken by the MIPS Instrument Team as part of the Guaranteed Time Observers (GTO) program (e.g., Dole et al. 2004a) and other groups. Although the xFLS is not unique in terms of depth or area coverage, the field has a large number (∼ 3000) of spectroscopic redshifts (P. Choi et al. 2005, in preparation; F. Marleau et al. 2005, in preparation), ancillary radio (Condon et al. 2003), and optical imaging data (Fadda et al. 2004) that permit detailed multiwavelength studies over a relatively large area. In this paper, we measure the source counts and use the available redshifts to constrain the rest-frame spectral energy distributions (SEDs) and derive the average infrared properties for the xFLS 70μm and 160μm populations. A cosmology of H_0 = 70 km s^{−1} Mpc^{−1}, Ω_M = 0.3, and Ω_Λ = 0.7 is assumed throughout this paper.

2. OBSERVATIONS

The xFLS survey covers a 4 deg^2 region (17^h18^m00^s, +59^∘30^′00^{′′}) within the northern continuous viewing zone of Spitzer^5. Inside the xFLS main field a smaller verification strip of 0.25 deg^2 centered at 17^h17^m00^s, +59^∘45^′00^{′′} was observed with an integration time of 4 times that of the main survey to characterize the completeness and source reliability of the main survey. In total, 27.7 hours of xFLS observations were taken in 2003 December with the MIPS instrument. An additional 16.8 hours of observations within the xFLS main field were taken in 2005 May to characterize the performance of the 70μm array at warmer telescope temperatures (T_{mirror} ≃ 9.5 K). These observations produced useful data at 70μm, but the 160μm

1Spitzer Science Center, California Institute of Technology 220–06, Pasadena, CA 91125; frayer@ipac.caltech.edu. 2Institut d’ Astrophysique Spatiale, bât 121, Université Paris Sud, F-91405 Orsay Cedex, France. 3Steward Observatory, University of Arizona, 933 North Cherry Avenue, Tucson, AZ 85721. 4Astronomy Program, Seoul National University, Shillim-dong, Kwanak-gu, Seoul, S. Korea, 2-880-9010. 5The extragalactic FLS data can be retrieved from the Spitzer Science Center at http://ssc.spitzer.caltech.edu/fls/ 1

2 Frayer et al.

data were not usable. Figure 1 shows the layout of the observations.

All of the MIPS observations were taken using the medium scan-rate mapping mode (4.2 s data collection events [DCEs]). The main-survey data were taken with adjacent 2 deg scan legs that were offset in the cross-scan direction by 276^{′′} (nearly the full field of view of the arrays). The main-survey was covered twice to identify potential asteroids and to increase the redundancy of the data set. Unfortunately, half of the MIPS-70 array was rendered useless after launch due to a cable failure outside the instrument (Rieke et al. 2004). Therefore, at 70μm each position of the main survey was covered by only one scan leg. Since the data were not scheduled exactly as originally planned, slight rotations between the 8 astronomical observation requests (AORs) yielded small gaps with zero coverage in the south-west corner of the main-survey 70μm map.

The verification strip was observed using 4 AORs with 0.5 deg scan legs at the medium scan rate. Each AOR covered the 0.5 deg×0.5 deg field using cross-scan steps of 148^{′′} (slightly less than half an array field of view). The warm test data taken in 2005 May were centered on the 70μm main-field. These data consisted of 6 AORs with 1.75 deg scan legs. Cross-scan steps of 148^{′′} were used to map the 1.75 deg×1.75 deg field once. Table 1 shows the average integration times, sensitivities, and area coverage for the 70μm and 160μm observations.

3. DATA REDUCTION

3.1. BCD Pipeline Processing

The raw 70μm and 160μm (MIPS-Germanium [Ge]) data were downloaded from the Spitzer Science Center (SSC) archive and were reduced using the offline Ge Reprocessing Tools (GeRT), available from the public SSC website. The GeRT uses an offline version of the SSC pipeline to produce the basic calibrated data products (BCDs), following the algorithms derived by the MIPS Instrument Team and the MIPS Instrument Support Team (Gordon et al. 2005). The processing was done using the latest software (SSC pipeline version S12) to take advantage of improvements not currently available for the online xFLS data products (made with pipeline version S11).

BCD processing has two main steps: (1) calculation of the slope of the data ramp, and (2) calibration of the slope image. For the xFLS MIPS-Ge data, the raw 4.2 s data ramps are comprised of 32 non-destructive reads per pixel (one DCE). After correcting for the electronic nonlinearity, cosmic ray events and other discontinuities are identified in the data ramps. The SSC pipeline identifies discontinuities using a maximum likelihood technique (Hesselroth et al. 2000). Linear slopes are calculated for the ramp segments between discontinuities and checked for consistency. The slopes from the segments are combined based on the empirical errors estimated from the scatter of the data within the ramp segments. Average slopes for each pixel are calculated to produce an uncalibrated slope image.

The second step of BCD processing is the calibration of the slope image. The calibration of MIPS-Ge data is based on frequent measurements of internal stimulator flashes

(stims) which are used to track the responsivity of the detectors as a function of time. For the xFLS medium scanrate data, the stim flashes are observed every 25 DCEs (118 s). The stim flash signal is measured by subtracting the previous “background” DCE from the stim frame which is taken at the same position on the sky. For each AOR, a stim response function (SR[t]) is calculated from interpolating between the stim minus background measurements.

After the determination of the stim response as a function of time (SR[t]), the BCD data are calibrated using the following equation: BCD(t) = F C[U(t)/SR(t) − DARK]/IC, (1) where U(t) is the uncalibrated slope image, DARK is the dark calibration file, and IC is the illumination correction calibration file which corrects for the combined illumination pattern from the telescope and the stim flash signal. The DARK and IC calibration files are stable and are generated by combining data from several different campaigns to improve the signal-to-noise. The flux conversion factor (F C) converts the instrument units into physical surface brightness units of MJy sr^{−1} and is derived from observations of standard calibrators (Sec. 3.4).

3.2. BCD Filtering

Before the 70μm bias level was lowered in 2004 March, the 70μm data showed significant data artifacts. Examples and discussion of MIPS-Ge artifacts are shown in the MIPS Data Handbook^6. The two main artifacts impacting the xFLS data are the stim flash latents and the variations of the slow response as a function of time. The 160μm data are affected by these issues to a lesser degree due to the faster time constants of the 160μm stressed- Germanium detectors. For point sources, the stim latent and slow response residuals are additive effects. The filtering of the 160μm data is straight-forward. We used the filtered BCDs products, which remove a running median per pixel as a function of time by subtracting the median value for the surrounding DCEs closest in time (ignoring the current DCE, stim DCEs, and bad data). This highpass time median filter removes data artifacts as well as the extended cirrus emission. To remove the stim latent artifacts at 160μm, we simply ignored the first DCE after the stim flash since the stim latents decay away within one DCE.

The filtering process for the 70μm data is slightly more complicated. The time median filter by itself does not remove all of the data artifacts. Stim latents remain for many DCEs and are correlated by column. Since the scan map direction is nearly along the columns of the array (along the y-axis), the column artifacts are amplified. We remove the column residuals by subtracting the median of the values along each column for every BCD. The combination of the high-pass time median filter per pixel and the column median filter removes the bulk of the data artifacts at 70μm.

The resultant rms is lower for narrow high-pass median filter widths (< 15 DCEs), but narrow filter windows can yield significant negative side-lobes around bright sources.

6http://ssc.spitzer.caltech.edu/mips/dh/

MIPS-Ge Observations of the xFLS 3

In addition, column filtering does not maintain point source calibration for the brightest sources (∼> 0.5 Jy). To avoid significant negative side-lobes and to preserve calibration, the filtering of the MIPS-Ge data was done in two passes. The data from the first filtering pass were co-added, and sources were extracted (Sec. 3.3) to find the location of the bright sources. The source positions within the original BCDs were masked and new filtering corrections were calculated in the second pass, ignoring the pixels containing sources. This second-pass filtering technique minimizes the data artifacts while preserving point-source calibration.

Different filtering methods were tested and optimized using the GeRT. At 70μm, we applied column filtering followed by a high-pass time median filter with a width of 12 DCEs to yield the deepest image. The final sensitivity of the filtered 70μm image was improved by more than a factor of two in comparison to data with no filtering. Filtering has less of an impact at 160μm, but is useful for deep observations of faint point sources. We adopted a high-pass time median filter width of 12 DCEs for the 160μm data using the second-pass filtering technique as done for 70μm.

3.3. Data Coaddition and Source Extraction

The filtered BCDs were coadded using the SSC mosaicing and source extraction software (MOPEX) (Makovoz & Marleau 2005). The data were combined ignoring bad data flagged in the BCD mask files (bmask) and the bad pixels defined by the static pixel mask (pmask). Using the redundancy of the MIPS data, additional spurious data values were removed via outlier rejection. The remaining data were corrected for array distortions and projected onto a sky grid with square pixels that were more than 2 times smaller than the original pixels. The output mosaic pixels are 4^{′′} at 70μm and 8^{′′} at 160μm. The data were averaged using weights proportional to the fractional area subtended by the original pixels as projected onto the output pixel grid. Since the calibration of the main, verification, and the warm 70μm data sets are consistent within measurement errors, all data were combined to yield the deepest images.

Sources were extracted from the final images using MOPEX. The MOPEX software uses a Point-source Response Function (PRF) image to optimize source detection and point source fitting. A PRF calibration image was made for each MIPS band by coadding isolated bright point sources within the xFLS field. A point source probability (PSP) image was made from non-linear matched filtering of the input image with the PRF. The PSP image represents the probability of having a point source above the noise at each pixel. The PSP image was multiplied by the input image to yield the filtered image used for source detection. The filtered image enhances the presence of point sources in the mosaic while smoothing out noise features that do not match the input PRF, providing a more robust image for source detection. After source detection, the original images were fitted with the PRF image via χ^2 minimization to extract source positions and flux densities. Regions containing multiple peaks were de-blended. For extended sources and/or close blends, not well fitted by the PRF, large aperture measurements were used to derive the total flux density for the source.

The noise across the images is non-uniform. For optimal source detection and extraction, an accurate representation of the uncertainties is needed. The MOPEX uncertainty image based on the input BCD pipeline uncertainties is useful for identifying the relative uncertainties across the image, but the pipeline errors typically underestimate the absolute uncertainty level for low background regions. The median level of the MOPEX uncertainty image was scaled to match the average empirical noise in the mosaics. By using a properly scaled uncertainty image, we find an average χ^2 for the fitted point sources of χ^2 ≃ 1, suggesting that the uncertainty image is self-consistent with the average point source errors in the data.

Several tests were done to validate the photometric results from MOPEX. No calibration differences were found for different sub-sets of the data. We also compared the photometry done with the MOPEX software with that from the program StarFinder (Diolaiti et al. 2000). Both programs use an empirical PRF to fit source flux density. The results from MOPEX and StarFinder agree to better than 5% for bright point sources (∼> 50 mJy at 70μm and

∼> 200 mJy at 160μm) and better than 10% rms down to the limits of the catalog, consistent with the uncertainties in the data. For faint sources detected in the MIPS-Ge bands, PRF fitting techniques yield more reliable results than aperture measurements. By comparing results between the verification data and the main survey, we find a consistency of ±10% for PRF matching techniques and a dispersion for aperture measurements of larger than ±25% at faint flux density levels.

3.4. Calibration

The absolute calibration is derived using observations of stars at 70μm and observations of asteroids and wellstudied luminous infrared galaxies at 160μm. The data were processed assuming flux conversion factors of 634 MJy sr^{−1} per MIPS-70 data unit and 42 MJy sr^{−1} per MIPS-160 data unit. The flux densities in the source catalogs were multiplied by the correction factors of 1.16 and 1.17 for the MIPS-70 and MIPS-160 bands respectively, which includes the color corrections associated with a constant νf_ν SED and updated calibration conversion factors based on the latest measurements. Additional color corrections for sources with non-constant νf_ν SEDs are negligible since the color corrections are similar for the range of SEDs appropriate for galaxies; f_ν ∝ ν^{−α}, where α ∼ 0 – 3. For flux density ranges of 50 mJy – 2 Jy, the absolute calibration uncertainty is estimated to be about 15% and 25% for the 70μm and 160μm bands respectively. No corrections have been made for possible flux nonlinearities, which may be significant for sources brighter than this nominal flux density range. Observers are recommended to check the latest information on MIPS calibration at the SSC web site.

We confirmed that the absolute 70μm flux density scale for the xFLS data is consistent with previous measurements made by IRAS to within 10%. For comparison with IRAS, we interpolated between the flux densities in IRAS- 60 and IRAS-100 bands (Beichman et al. 1988) to the ef-

7The effective wavelengths of the MIPS-24, 70, and 160 bands are 23.7μm, 71.4μm, and 155.9μm, respectively. Throughout this paper, the

4 Frayer et al.

fective wavelength of the MIPS-70 band (71.4μm)^7 applying the appropriate color corrections. For the five brightest sources in the field detected by IRAS, we derive a flux density ratio of Spitzer/IRAS = 1.0 ± 0.1 at 71.4μm. The calibration at 160μm is more uncertain given that xFLS sources have not been observed previously at wavelengths longer than 100μm. Simple SED model fits to the data indicate that the calibration at 160μm is consistent with IRAS to within 30%.

3.5. Mosaics and Catalogs

The MIPS-Ge mosaics and catalogs are available online at the SSC website. For both of the MIPS-70 and 160μm bands, we provide coadded mosaics of the entire xFLS data sets along with the corresponding coverage maps and uncertainty images. The mosaics are from the filtered products and have been background subtracted. The absolute level of the uncertainty image has been scaled to match the empirical noise within the mosaics. The coverage map represents the effective number of input BCDs for each pixel of the mosaic after outlier rejection. There are regions within the 70μm and 160μm mosaics with zero coverage. The 70μm image has gaps in the south-west corner of the mosaic due to non-overlapping AORs. The 160μm mosaics have a regular pattern of low coverage due to the unusable block of five detectors and the low redundancy of these observations.

Point-source catalogs were made for sources with S/N> 7 at each wavelength to insure high reliability. Sources near the edges or within regions of very low coverage were deleted from the public catalogs to avoid potentially spurious sources. In total, 687 70μm sources (Table 2) and 207 160μm sources (Table 3) are cataloged. The 70μm and 160μm catalogs are independent. The catalogs can be combined together or with xFLS data at other wavelengths, depending on the specific application. The average point source rms (1σ) is 2.8 mJy and 20 mJy for the 70μm warm+main data and 160μm main-survey data, respectively. For the deeper verification regions, the point source rms is 1.6 mJy at 70μm and 10 mJy at 160μm.

The images were examined visually to validate source detection and to determine the appropriate method for deriving the flux densities on a source by source basis. About 98% of the derived flux densities are based on PRF fitting (Sec. 3.3). The remaining sources mostly consist of bright extended galaxies and/or close blends that are not well fitted by the PRF. In these cases, large aperture measurements were made to derive the total flux densities. For bright extended sources that have one or more neighboring point sources within the aperture, the flux density of the bright galaxy was derived by subtracting the PRF measurement(s) of the faint point source(s) from the total aperture measurement.

Table 2&3 show the format for an example portion of the xFLS MIPS 70μm and 160μm catalogs published in the online edition of the Journal. The average radial positional errors are 2.^{′′}6 and 5.^{′′}2 (1σ) for the S/N> 7 MIPS-70 and 160μm sources respectively. No systematic differences are found for the 70μm source coordinates (< 0.^{′′}2) in comparison to the more accurate 24μm positions. For consistency with the 24μm and 70μm data, we correct the 160μm positions by 4.^{′′}7 to compensate for the systematic positional offset measured for the 160μm sources (a known issue for pre-S12 versions of the pointing pipeline). The flux densities have been color corrected assuming a constant νf_ν SED. The tabulated flux density errors include the absolute flux density uncertainties of 15% and 25% at 70μm and 160μm, respectively.

3.6. Reliability and Completeness

The verification data were used to test the reliability of the source detection and extraction techniques. For a high level of reliability at S/N < 10, it is important that the uncertainty image accurately reflects the small-scale spatial variations in the noise across the images. Using the uncertainties based on the BCDs, properly scaled to represent the average empirical noise in the data (Sec. 3.3), we obtained good results. Based on the deeper verification data, we do not find spurious sources with S/N > 5 in the main survey within the verification field. Sources detected at S/N > 4 are 80-85% reliable, and detections at the S/N > 3 level are only 50-60% reliable. Based on these results, we adopted a S/N > 5 cut for deriving the source counts in Sec. 4.1. A more conservative S/N> 7 criterion was adopted for the public catalogs (Sec. 3.5).

At 70μm the completeness and source counts were measured within the overlapping region of the warm and main fields (Fig. 1), while the entire main-field xFLS area was used at 160μm. Both empirical completeness estimates based on the verification data and simulated completeness measurements were made. The simulations of completeness were carried out by adding point sources with different flux densities into the mosaics at random locations, and then extracting sources using the same techniques adopted for the source catalogs. The simulations and empirical methods for estimating completeness gave consistent results. Using the adopted S/N> 5 criterion, the completeness level falls rapidly below 60% for S70< 14 mJy (Fig. 2) and S160< 100 mJy (Fig. 3). Similar completeness simulations were done for the deeper verification field, and we find 60% completeness levels of approximately 9 mJy and 60 mJy at 70μm and 160μm, respectively.

4. RESULTS AND DISCUSSION

4.1. Source Counts

The source counts are derived for the main xFLS and verification fields based on S/N> 5 catalogs corrected for completeness. At 70μm we use the 3.3 deg^2 region containing both the main and warm survey data. The 160μm counts are based on the entire 4.5 deg^2 area of the main survey. Figures 4&5 show the differential source counts (dN/dS × S^{2.5}) at 70μm and 160μm respectively. Over the entire observed range of flux density, both the 70μm and 160μm counts increase at super-Euclidean rates with decreasing flux density.

In total 845 sources at 70μm were detected (> 5σ at S70< 440 mJy) within the main+warm field area and 186 sources were detected (S70< 70 mJy) within the verification field (Table 4). In comparison at 160μm, 227 sources were detected in the main-field (S160< 880 mJy) and 45 sources (S160< 140 mJy) were found in the verification field (Table 5). The source counts are consistent between

flux densities for the MIPS-bands are defined as S24≡ S_ν (23.7μm), S70≡ S_ν (71.4μm), and S160≡ S_ν (155.9μm).

MIPS-Ge Observations of the xFLS 5

the main and verification data for the overlapping range of flux densities. The xFLS counts are also consistent within errors with the previous MIPS-Ge counts published by Dole et al. (2004a). The error bars for the source counts include the Poisson noise, the completeness errors, and the absolute flux density calibration uncertainty. The data were binned such that the errors are not dominated by Poisson statistics, except for the highest flux density bins. In the lowest flux density bins, the errors on completeness dominate the uncertainties.

Dole et al. (2004a) found a difference in the 70μm counts between the CDF-S and Marano observations, which they attributed to field variations. The measured 70μm xFLS counts are within the range of values previously measured, and closer to the CDF-S counts at faint flux densities. The xFLS-Ge counts are also consistent within uncertainties with the evolutionary models of Lagache et al. (2004), which were updated to match the Spitzer 24μm counts. However, the xFLS data points are systematically slightly lower than the predictions from current models. Counts from the wide-area SWIRE survey would be needed to check for possible field variations and to test whether the models require slight modifications.

Although the xFLS 70μm counts are at fainter levels than those previously published (Dole et al. 2004a), they are not yet deep enough to measure the location of the expected turn over of the differential counts (Fig. 4). The flux density at which the differential counts turn over provides important constraints on evolutionary models (Lagache et al. 2004; Chary & Elbaz 2001; King & Rowan- Robinson 2003; Xu et al. 2001), as shown by the 24μm data (Marleau et al. 2004; Papovich et al. 2004; Chary et al. 2004). At 160μm Spitzer is not expected to measure the turn over in the counts (Fig. 5), since the 160μm data are expected to be limited by confusion below 40 mJy (Dole et al. 2004b). The differential counts at 70μm are expected to turn over at around 10 mJy (Lagache et al. 2004), which is well above the confusion limit, suggesting that deeper 70μm counts would provide useful constraints for galaxy evolution models.

4.2. Infrared Colors

For high reliability, the source counts were derived using a S/N> 5 criterion for the individual bands. However, it is possible to maintain a high level of reliability at lower S/N by using the MIPS-24μm and/or radio data of the field. For studying the infrared colors, we used S/N> 4 source lists to increase the number of sources detected at high-redshift in the MIPS-Ge bands. The 70μm source list was bandmerged with the 24μm catalog (D. Fadda et al., in preparation). At S/N> 4, 1779 xFLS-70 sources have counterparts at 24μm within 6^{′′}. The different resolutions of the 24μm, 70μm, and 160μm data sets (6^{′′}, 18.^{′′}5, and 40^{′′}, respectively) complicate the identification of the counterparts in the MIPS bands. Out of the 1779 70μm sources, 9% have multiple candidate 24μm counterparts. To avoid potential spurious matches, we only used sources with one-to-one matches for studying the infrared colors. The 4σ xFLS-160 source list was matched to the 70μm data set using a positional matching radius of 13^{′′}. The resulting matched MIPS-160+70 source list was matched to the MIPS-70+24 source list. We find 301 160μm sources with one-to-one matches between all three MIPS-bands.

Out of the 1618 xFLS-70 sources with one 24μm positional match, 427 currently have redshifts. Approximately 57% of these sources come from the NOAO WIYN-Hydra radio-selected redshift survey (F. Marleau et al. in preparation), 16% of the redshifts are from the Keck-DEIMOS 24μm-selected sample (P. Choi et al., in preparation), and the remaining 27% of redshifts are from the SLOAN survey (Strauss et al. 2002). The largest redshift to date is for a quasar at z = 3.56. For the 160μm-selected sources with detections in all three MIPS-bands, about half (146) have known redshifts. Although the redshift survey of xFLS- Ge sources is not nearly complete (only 26% of the 70μm sources and 49% of the 160μm sources currently have redshifts), there are a sufficient number of sources to study the general trends in the infrared colors as a function of redshift for the sample.

We adopt two sets of SED models for studying the infrared colors. The first set of SED models is based on a simple modified blackbody (Blain, Barnard, & Chapman 2003). The SED is expressed as f_ν = ϵ_ν B_ν , where B_ν (T_d, ν) is the blackbody function for a dust temperature T_d, and ϵ_ν ∝ ν^β is the dust emissivity. In the mid-IR, we substitute a power-law of the form f_ν ∝ ν^{−α}, smoothly matching ϵ_ν B_ν at longer wavelengths (Blain et al. 2003). For this simple SED model, there are three free parameters: T_d, β, and α. The S160/S70 ratio constrains T_d, while the S70/S24 ratio measures α. The dust emissivity index β is not very well constrained by the Spitzer data alone. For simplicity, we adopt a constant value of β = 1.5 which is consistent with the results for low-redshift IRAS galaxies (Dunne et al. 2000).

The second set of SED models uses a physically more realistic approach by assuming a power-law distribution of dust masses as a function of radiation field intensity (Dale et al. 2001). The dust mass (M_d) as a function of the radiation field (U) is given by dM_d(U) ∝ U^{−γ} dU (Dale et al. 2001; Dale & Helou 2002)^8. Quiescent, cirrus-like dust regions are expected to have γ ≃ 2.5, while environments near active Hii regions are expected to be approximated by γ ≃ 1. For a mixture of active and quiescent regions, the average effective γ of star-forming galaxies should be between 1 ∼< γ ∼< 2.5.

Figure 6 shows the observed 70μm/24μm flux density ratio (S70/S24) plotted as a function of redshift with several predictions based on the SEDs of local galaxies. The majority of the xFLS sources have S70/S24 ratios within the range of values between the extreme ultraluminous starburst of Arp 200 and the more typical starburst M82. At moderate and high redshifts, infrared-cool ultraluminous infrared galaxies (ULIRGs, L > 10^{12} L_⊙), e.g., Arp 220, are expected to have the highest S70/S24 ratios, while warm-infrared ULIRGs, e.g., Mrk 231, and AGN dominated sources are expected to have lower S70/S24 ratios. Spiral galaxies without a strong infrared excess in their SED (e.g., M100) show decreasing S70/S24 ratios as a function of redshift; however, these galaxies are not detected at high redshifts (z > 0.5) in the xFLS-Ge survey. In general, the S70/S24 ratio can be used to help distinguish between AGN-dominated sources from star-forming

8We use γ to represent the “α” parameter of Dale et al. (2001).

6 Frayer et al.

galaxies, except in cases for which strong polycyclic aromatic hydrocarbon (PAH) emission features are redshifted into the 24μm band (e.g., M82 at z ∼ 2 in Fig. 6) and for AGN with strong silicate absorption features (e.g., Spoon et al. 2004) at z ∼ 1.5.

For the xFLS sample currently with redshifts, only 5% show low S70/S24 ratios consistent with AGN SEDs. The AGN population is fitted with T_d = 90 ± 30 K and α = 1.1 ± 0.3 (Fig. 6), which is consistent with the IRAS observations of Seyfert galaxies (Miley, Neugebauer, & Soifer 1985). The majority of the xFLS sample with redshifts are starbursts at z < 0.5. Figure 6 shows a large concentration of sources at z ∼ 0.2. The S70/S24 ratios based on the SEDs of quiescent and active galaxies (Dale & Helou 2002) intersect at z ∼ 0.2, which may contribute to this concentration of data points. For the galaxies with z ≃ 0.2, the average observed infrared color is S70/S24= 14 ± 5. In comparison with the IRAS population (Soifer et al. 1989; Sanders et al. 2003), the IRAS-60/IRAS-25 ratios correspond to a predicted ratio of S70/S24= 14 ± 3, consistent with the measured xFLS infrared colors. For the simple SED model, the average S70/S24 ratio corresponds to an infrared index of α = 2.4. Using SEDs of Dale & Helou (2002), values of γ ∼ 2 give the best agreement with the average S70/S24 ratios.

Although the majority of the 70μm sources do not have redshifts, the distribution of the S70/S24 ratios is the same for galaxies with and without redshifts (Fig. 7). The average mid-IR spectral index is α = 2.4 ± 0.4. For a simple power-law representation of the mid-IR SED, the modeled S70/S24 ratio is constant with redshift (e.g., Starburst solid line in Fig. 6). However, galaxies are expected to show significant variations in the S70/S24 ratio as strong PAH emission and mid-IR absorption features (e.g., Armus et al. 2004) are redshifted through the 24μm band (as seen for Arp 220 in Fig. 6).

Using simple modified blackbody SEDs, we calculate S160/S70 as a function of redshift and dust temperature for a constant value of α = 2.4 (Fig. 8). The average 160μm/70μm color temperature for the dust temperature is 30±5 K. This temperature is slightly lower than the average temperature of T_d = 38 ± 3 K (Dunne et al. 2000) and T_d ≃ 35–40 K (Soifer et al. 1989) derived for IRAS galaxies, but the longer wavelength 160μm band is more sensitive to regions with cooler dust temperatures than those observed by IRAS. The blackbody temperature of 30 K derived here agrees well with the long-wavelength ISO observations of infrared-bright spiral galaxies (Bendo et al. 2003). Bendo et al. (2003) found that T_d ≃ 30 K provided the best fit to the ISO data for β ∼1–2, consistent with the results in Figure 8. In the context of the SED models of Dale & Helou (2002), values of γ ∼ 2–2.5 provide the best agreement with the observed S160/S70 ratios.

The distribution of the S160/S70 ratios is measurably different for sources with and without redshifts (Fig. 9). Unlike the S70/S24 ratio which is on average roughly constant with redshift, the S160/S70 ratio is expected to increase with redshift (Fig. 8). Figure 9 shows an excess of 160μm sources without redshifts having high S160/S70 ratios (Log[S160/S70]∼> 0.8). These results may suggest that the excess sources are at high redshift (z ∼> 0.5) and that the current redshift sample of 160μm sources may be biased toward lower redshifts.

4.3. Infrared Luminosity

For the 70μm selected sources, we can estimate the average infrared luminosity for the xFLS population. The rest-frame wavelength of the MIPS-70 band corresponds to 60μm at a redshift of z ≃ 0.2. The FIR luminosity (42.5– 122.5μm) can be derived from the rest-frame 60μm and 100μm flux densities (Helou, Soifer, & Rowan-Robinson 1985). By using the SED associated with the average model parameters of T_d ≃ 30 K and α ≃ 2.4 for the xFLS sources, we estimate a rest-frame S100/S60 ratio of 2.3. This is consistent with the values of S100/S60= 2 ± 1 observed for the bulk of the IRAS galaxies (Sanders et al. 2003). Based on the rest-frame S100/S60 ratio, the corresponding FIR flux is FIR(W m^{−2}) = 6.1 × 10^{−14} (S70/Jy) for the observed S70 flux density at z ≃ 0.2. For galaxies at z ≃ 0.2, the average value of S70 is 33 mJy. This corresponds to a FIR luminosity of L(FIR)= 6.0 × 10^{10} L_⊙. Using the models of Dale et al. (2001) and the estimated S100/S60 ratio, the total infrared luminosity (3–1100μm) L(TIR)= 2.3L(FIR). Hence, the average total infrared luminosity of the 70μm-selected xFLS galaxies at z ≃ 0.2 is about L(TIR)= 1.4 × 10^{11} L_⊙.

Although the redshift survey for the 70μm-selected sources is not currently complete, the infrared luminosity function can be estimated at low redshift for bright flux densities. At S70> 50 mJy, 72% (65/90) of sources have redshifts. The majority of sources without redshifts are suspected to be at high redshift given that the observed redshift distribution declines significantly at z > 0.3 and the models predict that the majority of sources at these flux density levels are at z > 0.3. Based on the models of Lagache et al. (2004), about 40–45% of galaxies with S70> 50 mJy are predicted to be at z < 0.3. Assuming ∼ 100% completeness at z < 0.3 (i.e., assume all sources with S70> 50 mJy currently without redshifts are at z > 0.3), we find 64±9% (58/90) of galaxies with S70> 50 mJy and z < 0.3. If the current xFLS redshift surveys are not complete at z < 0.3 (with S70> 50 mJy), then the models would be even more discrepant with the observations. Hence, the models may under predict the percentage of low redshift 70μm sources at bright flux densities. There are two potential caveats on this result. First, a small percentage (< 1%) of 70μm sources do not have 24μm counterparts, and these sources are likely to be at high redshift (e.g., at z ∼ 1.5 where the silicate absorption feature is redshifted into the 24μm band). However, there is only one 70μm source without a 24μm counterpart with S70> 50 mJy, so this population, by itself, cannot account for the apparent discrepancy with the models. The second caveat is that we have thrown out 9% of the 70μm sources with multiple possible 24μm matches (Sec. 4.2). The 70μm sources with multiple candidate 24μm counterparts tend to be brighter on average and typically have low redshifts. In fact, we find only one such source with z > 0.3 and with S70> 50 mJy (1/70 with redshifts). Additional redshift surveys are needed to confirm the findings here which suggest that the current models slightly over predict the percentage of bright 70μm sources (S70> 50 mJy) at high-redshift (z > 0.3) and their contribution to the total CIB.

To estimate the infrared luminosity function, we use the

MIPS-Ge Observations of the xFLS 7

sample of 58 galaxies with S70> 50 mJy and z < 0.3. We adopt the 1/V_{max} method following the calculation of the IRAS νL_ν (60μm) luminosity function (Soifer et al. 1987). For each source, the maximum volume (V_{max}) at which the source would be included in the sample is computed, using V_{max}(z = 0.3) as an upper bound for the survey. The 70μm flux density is converted to a rest-frame 60μm flux density using a power-law interpolation between the observed 24μm and 70μm measurements. The calculated xFLS 60μm luminosity function (ρ) shown in Figure 10 represents the space density of galaxies per Mpc^3 per magnitude in luminosity. Even though the current xFLS sample is a factor of 100 deeper in flux density than the IRAS 60μm bright galaxy sample (Soifer et al. 1987; Sanders et al. 2003), the xFLS sample does not yet probe the high luminosity end of the luminosity function (Log(νL_ν [60μm]/ L_⊙) > 11.5), given the low redshift range (median redshift of only z = 0.096) and small area of the current sample. The derived xFLS luminosity function agrees well with the IRAS 60μm luminosity function (Soifer et al. 1987). Below Log(νL_ν [60μm]/ L_⊙) < 10.5, ρ ∝ (ν L_ν )^{−0.8} (Soifer et al. 1987), while at higher luminosities ρ ∝ (ν L_ν )^{−2.2} (Sanders et al. 2003). Additional redshifts for the faint S70∼10 mJy sources are needed to constrain the evolution of the luminosity function out to z ∼ 1. 4.4. Infrared to Radio Correlation

In the local universe, galaxies over a wide range of luminosity and Hubble types follow the empirical IR/radio correlation (Helou et al. 1985; Condon 1992). Observations of ISO sources (Gruppioni et al. 2003) indicate that the mid-IR to radio relationship holds out to z ∼ 0.6, and the data for the SCUBA sources suggest that the FIR to radio relationship may be applicable even at z ∼ 2–3 (e.g., Chapman et al. 2005). With Spitzer we can measure the IR/radio relationship out to z ∼ 1 by direct observations near the peak of the SED, instead of estimating the IR luminosity from the shorter mid-IR or longer sub-mm wavelengths. Appleton et al. (2004) presented the first estimate of the IR/radio relationship based on Spitzer data. Their results were based on the early analysis of the xFLS data. Here we present updated results using more sensitive 70μm data.

The sample of 427 xFLS-70 sources with redshifts and with only one candidate 24μm counterpart (Sec. 4.2) was matched to the 4σ radio catalog (Condon et al. 2003). Within 3^{′′}, 325 of these xFLS-70 sources (76%) have radio counterparts. Figure 11 shows the observed S70/S(20 cm) ratio as a function of redshift for the matched galaxies.

At low redshift, the FIR to radio q-parameter is defined as q ≡ Log(F IR/(3.75 × 10^{12}W m^{−2})) − Log(S(20cm)/(W m^{−2}Hz^{−1})) = 2.3 ± 0.2 (Helou et al. 1985). Based on the typical SED of the xFLS sample of galaxies (Sec. 4.2), the corresponding predicted q parameter for the 70μm to radio flux density ratio is q_{70} ≡ Log(S70/S[20cm]) = 2.09 at z ≃ 0.2. We measure an average value of q_{70} = 2.10 ± 0.16 for xFLS galaxies at z ≃ 0.2. By comparison, Appleton et al. (2004) derived a similar value of q_{70} = 2.16 ± 0.17, but unlike the previous results we observe the expected decrease of observed q_{70} as a function of redshift (Fig. 11). Based on the SEDs of local galaxies, we expect the observed q_{70} parameter to decrease with redshift since the average IR spectral index is significantly steeper than the radio spectral index. Assuming an IR spectral index of α = 2.4 based on the observed average ratio of S70/S24= 14 and the typical non-thermal radio spectral index of α = 0.8 (f_ν ∝ ν^{−α}, Condon et al. 1992), we expect q_{70} ∝ (1+z)^{−1.6}. From a least-squares fit to the data, we estimate q_{70} ∝ (1 + z)^{−1.4±0.6}. Hence, the observed q_{70} for the xFLS galaxies follows the expected trend out to at least z ∼ 1 (Fig. 11).

5. CONCLUSIONS

The Spitzer 70μm and 160μm observations of the xFLS are presented. For the deeper verification field data, we measure number counts down to 8 mJy and 50 mJy (5σ) in the 70μm and 160μm bands, respectively. The observed xFLS counts are consistent with previous measurements (Dole et al. 2004a) and are consistent within the uncertainties with the evolutionary models (Lagache et al. 2004). Based on the models of Lagache et al. (2004), approximately 35% of the CIB is resolved at 70μm and 15% is resolved at 160μm at the depth of the verification data. The observed fraction of low redshift galaxies at bright 70μm flux densities is larger than model predictions and the total counts appear slightly systematically lower. These results may suggest the models overestimate the contribution of high-redshift galaxies at bright 70μm flux densities to the total CIB. Deeper 70μm observations are needed for measuring the expected turn over in the differential source counts to provide better constraints on the evolutionary models.

The observed xFLS infrared colors S70/S24 and S160/S70 are consistent with the results from the IRAS and ISO missions. Modeled SED fits suggest an average 160μm/70μm color temperature for the dust of T_d ≃ 30 K, for the 160μm-selected sample of galaxies. This temperature is consistent with ISO observations of spirals (Bendo et al. 2003). The average S70/S24 ratio implies an infrared spectral index of α ≃ 2.4, which agrees with expectations from the average IRAS S60/S24 ratio (Soifer et al. 1989; Sanders et al. 2003). The observed 70μm infrared to radio correlation of the xFLS sources also agrees well with the FIR-to-radio correlation found for local star-forming galaxies (Helou et al. 1985; Condon et al. 1992). We observe a trend of decreasing S70/S(20 cm) as a function of redshift consistent with expectations based on the SEDs of local galaxies.

Given the lack of sufficient redshift measurements for the high-redshift faint xFLS-Ge sources, we can only derive an infrared luminosity function at low redshift for only the brightest 70μm galaxies. With these data, we calculate a rest-frame 60μm luminosity function for the xFLS that agrees well with the IRAS luminosity function (Soifer et al. 1987). In the future, it may be possible to measure the evolution of the luminosity function out to moderate redshifts with the xFLS data when additional redshift surveys of faint 70μm sources become available.

We thank all of our colleagues associated with the Spitzer mission who have made these observations possible. This work is based on observations made with the Spitzer Space Telescope, which is operated by the Jet Propulsion Laboratory, California Institute of Technology under NASA contract 1407.

8 Frayer et al.

REFERENCES

Appleton, P. N., et al. 2004, ApJS, 154, 147 Armus, L., et al. 2004, ApJS, 154, 178 Beichman, C. A., Neugebauer, G., Habing, H. J., Clegg, P.

E., & Chester, T. J. 1988, Infrared Astronomical Satellite (IRAS) Catalogs and Atlases. Volume 1: Explanatory Supplement (Washington, DC: US Government Printing Office) Bendo, G. J., et al. 2003, AJ, 125, 2361 Blain, A. W., Barnard, V. E., & Chapman, S. C. 2003, MNRAS, 338, 733 Blain, A. W., Smail, I., Ivison, R. J., Kneib, J.-P., & Frayer, D. T.

2002, Physics Reports, 369, 111 Chapman, S. C., Blain, A. W., Smail, I., & Ivison, R. J. 2005, ApJ,

622, 772 Chary, R., et al. 2004, ApJS, 154, 80 Chary, R., & Elbaz, D. 2001, ApJ, 556, 562 Condon, J. J. 1992, ARA&A, 30, 575 Condon, J. J., Cotton, W. E., Yin, Q. F., Shupe, D. L., Storrie-

Lombardi, L. J., Helou, G., Soifer, B. T., & Werner, M. W. 2003, AJ, 125, 2411 Dale, D. A., & Helou, G. 2002, ApJ, 576, 159 Dale, D. A., Helou, G., Contursi, A., Silbermann, N. A., & Kolhatkar,

S. 2001, ApJ, 549, 215 Diolaiti, E., Bendinelli, O., Bonaccini, D., Close, L., Currie, D., &

Parmeggiani, G. 2000, A&AS, 147, 335 Dole, H., et al. 2004a, ApJS, 154, 87 Dole, H., et al. 2004b, ApJS, 154, 93 Dunne, L., Eales, S., Edmunds, M., Ivison, R., Alexander, P., &

Clements, D. L. 2000, MNRAS, 315, 115 Elbaz, D., Cesarsky, C. J., Chanial, P., Aussel, H., Franceschini, A.,

Fadda, D., & Chary, R. R. 2002, A&A 384, 848 Elbaz, D. et al. 1999, A&A, 351, L37 Fadda, D., Jannuzi, B. T., Ford, A., & Storrie-Lombardi, L., J. 2004,

AJ, 128, 1

Gordon, K. D., et al. 2005, PASP, 117, 503 Gruppioni, C., Pozzi, F., Zamorani, G., Ciliegi, P., Lari, C., Calabrese, E., La Franca, F., & Matute, I. 2003, MNRAS, 341, L1 Hauser, M. G., & Dwek, E. 2001, ARA&A, 39, 249 Helou, G., Soifer, B. T., & Rowan-Robinson, M. 1985, ApJ, 298, L7 Hesselroth, T., Ha, E. C., Pesenson, M., Kelly, D. M., Rivlis, G., & Engelbracht, C. W. 2000, Spaceborne Infrared Remote Sensing VIII, SPIE Conference Proceedings, 4131, 26 King, A. J., & Rowan-Robinson, M. 2003, MNRAS, 339, 260 Lagache, G., et al. 2004, ApJS, 154, 112 Lonsdale, C. J., et al. 2004, ApJS, 154, 54 Lortet, M.-C., Borde, S., & Ochsenbein, F. 1994, A&AS, 107 193 Makovoz, D., & Marleau, F. R. 2005, PASP, in press Marleau, F. R., et al. 2004, ApJS, 154, 66 Miley, G. K., Neugebauer, G., & Soifer, G. T. 1985, ApJ, 293, L11 Neugebauer, G., et al. 1984, ApJ, 278, L1 Papovich, C., et al. 2004, ApJS, 154, 70 Rieke, G. H., et al. 2004, ApJS, 154, 25 Rodighiero, G., Fadda, D., Franceschini, A., & Lari, C. 2005, MNRAS, 357, 449 Sanders, D. B., Mazzarella, J. M., Kim, D.-C., Surace, J. A., & Soifer, B. T. 2003, AJ, 126, 1607 Soifer, B. T., Boehmer, G., Neugebauer, G., & Sanders, D. B. 1989, AJ, 98, 766 Soifer, B. T., Sanders, D. B., Madore, B. F., Neugebauer, G., Danielson, G. E., Elias, J. H., Lonsdale, C. J., & Rice, W. L. 1987, ApJ, 320, 238 Spoon, H. W. W., et al. 2004, ApJS, 154, 184 Strauss, M. A., et al. 2002, AJ, 124, 1810 Werner, M. W., et al. 2004, ApJS, 154, 1 Xu, C., Lonsdale, C. J., Shupe, D. L., O’Linger, J., & Masci, F. 2001, ApJ, 562, 179

Fig. 1.— The layout of the 70μm and 160μm fields for the xFLS observations. The 70μm main and verification fields are shown by the solid-lines, while the 160μm xFLS fields are shown as dashed-lines. The location of the 70μm-warm observations taken in 2005 May is shown by the dotted-line. The right ascension and declination offsets are with respect to the center of the main field (17^h18^m00^s, +59^∘30^′00^{′′} ).

MIPS-Ge Observations of the xFLS 9

Fig. 2.— The 70μm completeness level as a function of flux density for the verification and warm+main xFLS surveys. The diamonds represent empirical measurements of the warm+main survey based on the deeper verification data, and the squares and solid circles are the results of simulations for the warm+main and verification fields respectively. The completeness estimates are for the S/N> 5 source lists used to derive the counts.

Fig. 3.— The 160μm completeness level as a function of flux density for the verification and main xFLS surveys. The diamonds represent empirical measurements of the main survey based on the deeper verification data, and the squares and solid circles are the results of simulations for the main and verification fields respectively. The completeness estimates are for the S/N> 5 source lists used to derive the counts.

10 Frayer et al.

Fig. 4.— The 70μm differential number counts for the verification (solid circles) and warm+main (squares) xFLS surveys. The diamonds represent previous MIPS-GTO measurements (Dole et al. 2004a). The vertical error bars include the uncertainties of the absolute flux density scale and completeness, and the horizontal line segments show the bin sizes. The solid line is the evolutionary model of Lagache et al. (2004).

Fig. 5.— The 160μm differential number counts for the verification (solid circles) and main (squares) xFLS surveys. The diamonds represent previous MIPS-GTO measurements (Dole et al. 2004a). The vertical error bars include the uncertainties of the absolute flux density calibration scale and completeness, and the horizontal line segments show the bin sizes. The solid line is the evolutionary model of Lagache et al. (2004).

MIPS-Ge Observations of the xFLS 11

Fig. 6.— The S70/S24 flux density ratio for 70μm sources with redshifts. The ULIRGs Arp 220 and Mrk 231, the starburst M82, and the spiral galaxy M100 are shown as dashed lines. The solid lines represent simple modified blackbody SED models for starbursts (α = 2.4, T_d = 30 K) and AGN (α = 1.1, T_d = 90 K). The dotted lines show the SED models of Dale & Helou (2002) as a function of γ, where γ ∼ 2–2.5 represent more quiescent star-forming galaxies and γ ∼ 1.5–1 represent more active galaxies. The plus symbol shows the predicted S70/S24 ratio at a redshift z = 0.2 based on the average IRAS S60/S25 ratio. The typical error bar for the data points from the 4σ source lists is shown in the lower right.

Fig. 7.— The distributions of the S70/S24 flux density ratios for 70μm sources with redshifts shown in Fig. 6 (dashed line) and for all 70μm-selected sources (solid line). Values for a range of infrared spectral indexes (α) are shown by the vertical dotted lines.

12 Frayer et al.

Fig. 8.— The S160/S70 flux density ratio for 160μm-selected sources with redshifts. The solid lines show simple modified blackbody SED models based on different dust temperatures (20–50 K) assuming an infrared spectral index of α = 2.4 and a dust emissivity index of β = 1.5. The dotted lines show the SED models of Dale & Helou (2002) as a function of γ. The typical error bar for the data points from the 4σ source lists is shown in the lower right.

Fig. 9.— The distributions of the S160/S70 flux density ratios for the 160μm sources with redshifts shown in Fig. 8 (dashed line) and for all 160μm-selected sources (solid line). The excess of sources without redshifts at the higher S160/S70 ratios may suggest that the current redshift sample of 160μm sources is biased toward lower redshifts.

MIPS-Ge Observations of the xFLS 13

Fig. 10.— The xFLS rest-frame 60μm luminosity function based on the sources with S70> 50 mJy and z < 0.3 (solid circles). The IRAS 60μm luminosity function is represented by the squares (Soifer et al. 1987), corrected for the adopted value of H_0 = 70 km s^{−1} Mpc^{−1}. The dotted-line shows the double power-law fit of the luminosity function based on the IRAS data (Soifer et al. 1987; Sanders et al. 2003).

Fig. 11.— The S70/S(20 cm) flux density ratio for the 70μm-selected xFLS sources with redshifts between 0 < z < 1. The dotted-line shows the expected behavior of S70/S(20 cm)∝ (1 + z)^{−1.6}, assuming power-law approximations for the SEDs at radio and infrared wavelengths. The dashed-line shows the result of a least-squares fit [S70/S(20 cm)∝ (1 + z)^{−1.4±0.6} ]. The plus symbol shows the predicted value of the S70/S(20 cm) ratio based on the local infrared to radio correlation. The typical error bar for the data points from the 4σ source lists is shown in the lower right.

14 Frayer et al.

Table 1 Spitzer Extragalactic FLS MIPS-Ge Observations

t_{int} (s) 5σ (mJy) Area Field 70μm 160μm 70μm 160μm (deg^2)

Main . . . . . . . 42 8 19 100 4.5 Verification . 252 42 8 50 0.35 Warm+Main 84 . . . . . . 14 . . . . . . . 3.3

Note.—The integration time (t_{int}) is the average integration time for the field. The approximate average 5σ noise levels are for point sources and do not include the absolute flux density calibration uncertainties.

Table 2 Extragalactic FLS 70μm Catalog

Source Name α(J2000) δ(J2000) Error S70 Flag (deg) (deg) (arcsec) (mJy) (1) (2) (3) (4) (5) (6)

FLS70 J172723.3+601626 261.84712 60.27414 1.9 81.4±12.9 prf FLS70 J172716.2+600051 261.81791 60.01433 1.6 1610.1±244.6 a120m FLS70 J172709.5+600141 261.78960 60.02815 2.1 77.3±12.7 prf FLS70 J172704.7+593736 261.76978 59.62680 2.0 62.1±9.9 prf FLS70 J172651.1+601851 261.71329 60.31419 3.3 34.7±7.0 prf

Note.—The entire xFLS 70μm catalog (> 7σ) is presented in the electronic edition of the Astronomical Journal. A portion of Table 2 is shown here for guidance regarding the form and content of the catalog. Column (1) gives the source name following the IAU designations (Lortet, Borde, & Ochsenbein 1994). Column (2) and column (3) are the right ascension (α) and declination (δ) J2000.0 source positions in decimal degrees. Column (4) provides the radial positional uncertainty in arcsec (1σ). Column (5) gives the flux density measurement in mJy. The flux density errors include the uncertainties of the absolute flux density scale. Column (6) provides a flag for the flux density measurement method. A flag of “prf” indicates that the source was fitted by the PRF, while a flag starting with an “a” indicates that an aperture measurement was used (for cases of extended sources and/or close blends). The number following the “a” gives the aperture diameter in arcsec; e.g., a120 implies an aperture diameter of 120^{′′}. Sources with aperture flags ending with a “m” represent bright galaxies not well fitted by the PRF and with nearby companions; in these cases, the flux density of the bright galaxy was derived by subtracting the PRF measurement(s) of the nearby faint point source(s) from the total aperture flux density.

MIPS-Ge Observations of the xFLS 15

Table 3 Extragalactic FLS 160μm Catalog

Source Name α(J2000) δ(J2000) Error S160 Flag (deg) (deg) (arcsec) (mJy) (1) (2) (3) (4) (5) (6)

FLS160 J172902.1+600523 262.25801 60.08859 3.4 294.8±76.0 prf FLS160 J172855.5+600026 262.23039 60.00619 7.4 154.4±44.2 prf FLS160 J172851.3+600821 262.21295 60.13807 3.8 293.7±76.4 prf FLS160 J172826.5+600539 262.10963 60.09320 3.0 1211.0±310.5 a192 FLS160 J172817.7+600100 262.07271 60.01573 5.9 188.4±50.97 prf

Note.—The entire xFLS 160μm catalog (> 7σ) is presented in the electronic edition of the Astronomical Journal. A portion of Table 3 is shown here for guidance regarding the form and content of the catalog. Column headers are the same as described in Table 2.

Table 4 Extragalactic FLS 70μm Number Counts

Average S_ν S_{low} S_{high} Number Completeness dN/dS S^{2.5} (mJy) (mJy) (mJy) (gal sr^{−1} Jy^{1.5})

8.1 7 9 46 0.50±0.15 2556±1030 10.6 9 13 61 0.80±0.08 2073± 575 16.5 13 20 40 1.0±0.05 1866± 522 24.5 20 30 21 1.0±0.03 1847± 582 46.0 30 70 18 1.0±0.03 1912± 626

13.9 12 16 230 0.60±0.15 2172±744 18.4 16 22 230 0.90±0.08 1883±453 26.7 22 34 200 1.00±0.05 1931±466 40.3 34 50 89 1.00±0.03 1800±451 61.2 50 80 54 1.00±0.03 1660±439 110.9 80 140 25 1.00±0.03 1698±514 227.9 140 440 17 1.00±0.03 1398±464

Note.—The first five entries are the 70μm counts for the verification field, while the remaining entries are for the warm+main 70μm survey. The uncertainties for the differential counts (dN/dS S^{2.5}) include the Poisson noise, the completeness uncertainty, and the absolute flux density calibration uncertainty of 15%. The counts are based on the > 5σ source lists, corrected for completeness.

16 Frayer et al.

Table 5 Extragalactic FLS 160μm Number Counts

Average S_ν S_{low} S_{high} Number Completeness dN/dS S^{2.5} (mJy) (mJy) (mJy) (gal sr^{−1} Jy^{1.5})

68.0 56.4 77.0 17 0.55±0.15 17156± 8978 85.9 77.0 97.5 15 0.85±0.08 17541± 8155 116.4 97.5 138.6 13 0.97±0.05 14231± 6678

101.8 92.4 112.9 60 0.55±0.15 12682± 6104 124.0 112.9 133.4 45 0.65±0.1 13170± 5688 152.8 133.4 174.5 44 0.80±0.08 8825± 3674 211.7 174.5 256.6 43 0.92±0.05 8472± 3460 320.7 256.6 420.8 25 1.0±0.05 6399± 2738 679.0 420.8 882.6 10 1.0±0.05 5935± 2926

Note.—The first three entries are the 160μm counts for the verification field, while the remaining entries are for the main 160μm survey. The uncertainties for the differential counts (dN/dS S^{2.5}) include the Poisson noise, the completeness uncertainty, and the absolute flux density calibration uncertainty of 25%. The counts are based on the > 5σ source lists, corrected for completeness.