arXiv:astro-ph/0506273v1 13 Jun 2005

Mon. Not. R. Astron. Soc. 000, 000–000 (0000) Printed 23 May 2014 (MN L^ATEX style file v2.2)

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region

E. L. Taylor^1, R. G. Mann^1, A. N. Efstathiou^2, T. S. R. Babbedge^3, M. Rowan-Robinson^3, G. Lagache^4, A. Lawrence^1, S. Mei^5, M. Vaccari^3, Ph. Héraudeau^6, S. J. Oliver^7, M. Dennefeld^8, I. Perez-Fournon^9, S. Serjeant^{10}, E. González-Solares^{11}, J.–L. Puget^4, H. Dole^{12}, C. Lari^{13}

1Institute for Astronomy, University of Edinburgh, Royal Observatory, Blackford Hill, Edinburgh, EH9 3HJ, UK 2Department of Computer Science and Engineering, Cyprus College, 6 Diogenes Str, 1516 Nicosia, Cyprus 3Astrophysics Group, Imperial College London, Blackett Laboratory, Prince Consort Road, London SW7 2BZ 4Institut d’Astrophysique Spatiale, Bât. 121, Université Paris XI, F-91405 Orsay Cedex 5Johns Hopkins University, 3400 N. Charles Street, 21218, Baltimore, MD, USA 6Kapteyn Astronomical Institute, P.O. Box 800, 9700 AV Groningen, The Netherlands 7Astronomy Centre, Department of Physics & Astronomy, University of Sussex, Brighton, BN1 9QJ, UK 8Institut d’Astrophysique de Paris, 98bis Boulavard Arago, F-75014 Paris 9Instituto de Astrofisica de Canarias, C/Vía Láctea s/n. 38200 La Laguna, Tenerife, Spain 10Centre for Astrophysics & Planetary Science, School of Physical Sciences, University of Kent, Canterbury, Kent CT2 7NR 11Institute of Astronomy, University of Cambridge, Madingley Road, Cambridge CB3 0HA 12Steward Observatory, University of Arizona, 933 N Cherry Ave Tuscon AZ 85721, USA 13Instituto do Radioastronomia, Via P. Gobetti 101, 40129, Bologna, Italy

Received ??

ABSTRACT We report on a search for the optical counterparts of 175 μm – selected sources from the Far–Infrared Background (FIRBACK) survey in the European Large Area ISO Survey (ELAIS) N2 field. Applying a likelihood ratio technique to optical catalogues from the Isaac Newton Telescope – Wide Field Survey (INT–WFS), we found optical identifications for 33 out of 55 FIRBACK sources in this field. These were then reassessed in the light of associations with the ELAIS final catalogue for the the N2 field, to yield a final set of 31 associations. We have investigated the nature of this population through a comparison of their observed spectral energy distributions (SEDs) with predictions from radiative transfer models which simulate the emission from both cirrus and starburst components. We find the far–infrared sources to be 80 per cent star bursting galaxies with their starburst component at a high optical depth. The resulting SEDs were used to estimate far–infrared luminosities, star formation rates, dust temperatures and dust masses. The N2 FIRBACK population is found to consist of four suspected ultra–luminous infrared galaxies (ULIRGs) with L_{FIR} ∼ 10^{12} L_⊙ and SFR_{FIR} > 100 M_⊙yr^{−1}, a number of luminous infrared galaxies (LIRGs) with moderate star formation rates and L_{FIR} ∼ 10^{11} L_⊙ and a population of low redshift quiescently star forming galaxies. We also discuss the implications of these results for current evolutionary models.

Key words: galaxies: evoluntion – galaxies: fundamental parameters – galaxies: starburst – infrared: galaxies – surveys

1 INTRODUCTION

Evidence available in the 1960s and 1970s from regions of active star formation in nearby galaxies, and our own Milky Way, suggested that star forming galaxies would be strong sources of thermal infrared radiation, and implied that regions of dust and molecular clouds should be found within them (Sunyaev et al. 1978). It was then predicted that this dust reprocessed redshifted starlight from distant galaxies, would form a far–infrared background (FIRB) signal (Partridge and Peebles 1967).

With the advent of the Infrared Astronomical Satellite (IRAS) in the 1980s hundreds of previously undetected

© 0000 RAS

2 E. L. Taylor et al.

galaxies were discovered, which emit up to 95 per cent of their total luminosity in the infrared (Soifer et al. 1987). This indicated significant dust reprocessing of their starlight and implied that star formation rates previously calculated from rest frame optical/uv luminosities were only a lower limit. Follow up redshift surveys, such as QDOT (Lawrence et al. 1999), showed that these galaxies were far more numerous in the past (e.g. Oliver et al. 1992), requiring stronger cosmological evolution than had previously been predicted by conventional models for the passive evolution of galaxies and providing support was building for models in which starbursts are important evolutionary mechanisms (Lonsdale et al. 1990).

The IRAS results allowed far tighter limits to be put on the level of the predicted far–infrared background. Hacking and Soifer (1991) predicted that the background should be detectable by the Cosmic Background Explorer satellite (COBE) at 100 μm and noted that discovering its exact level would allow further refinement of evolutionary models. No-evolution models placed a lower limit on the predicted background level, while detection of a strong background would indicate the existence of a population of objects with significant cosmological evolution. The FIRB was finally discovered by Puget et al. (1996) in the whole sky survey taken by FIRAS on COBE just as Hacking and Soifer (1991) had predicted.

Puget et al. (1996) found a signal which could be explained by the thermal emission from particles with temperatures of 20 and 12 K with emissivities of 3 × 10^{−6} and 5 K with an emissivity of 3 × 10^{−5}. This detection has fueled a new generation of galaxy evolution models but it is clear that to further differentiate between them we must understand the nature of the objects which contribute to the far–infrared background.

1.1 The Far–Infrared Background

The FIRBACK survey was carried out jointly with the ELAIS team at 175 μm using ISOPHOT (Lemke et al. 1996) on the Infrared Space Observatory (ISO) (Kessler et al. 1996). This survey aimed to resolve the FIRB into discrete sources and also allow studies of FIRB fluctuations. FIR- BACK covered 3 main fields [South Marano, N1 and N2] covering a total area of 4 deg^2. The final source catalogue contains 106 sources with fluxes between 180 mJy and 2.4 Jy and a supplementary catalogue containing 90 sources with fluxes 135-180 mJy (Dole et al. 1999, 2001). The northern fields lie within the previously defined ELAIS N1 and N2 survey regions whose selection was based primarily on their low Galactic cirrus emission (as quantified by IRAS 100 μm emission) and high visibility, given ISO’s orbit. This choice of fields allows multiwavelength follow–up thus providing a global view of galaxy evolution.

There have been several suggestions as to the nature of these 175 μm ISO sources. Two sources were examined in detail in the optical and near-IR by Chapman et al. (2002) who found two nearby (z < 1) galaxies with characteristic temperatures of ∼30 K and ∼50 K and bolometric luminosities (40–200 μm) of 10^{11} −10^{12} L⊙. These galaxies were classified as ULIRGs with morphologies suggesting the early stages of mergers adding weight to arguments for interactions sparking periods of increased star formation. A sample of ISO

Figure 1. Distribution of P_{ran} values for chosen source counterparts.

175 μm sources were also examined at sub–mm and near-IR wavelengths by Sajina et al. (2003) who found a bimodal galaxy population: one population of normal star forming galaxies at z ∼ 0 and a second more luminous population at z ∼ 0.4 − 0.9. There has been spectroscopic follow–up of the brightest 175 μm sources in the FIRBACK South Marano field (Patris et al. 2003) which were found to be nearby (z < 0.3), heavily extincted (Av ∼ 3 with extreme cases up to Av = 7), star forming galaxies with moderate star formation rates (a few 10 M⊙yr^{−1}). These were classified at LIRGs, with LIR ≃ 10^{11} L⊙.

We have gone one step further by seeking associations for all 55 N2 175μm ISO sources in the FIRBACK survey with optical sources from the INT–WFS catalogues in four bands (g’,r’,i’,Z ), the other ELAIS survey wavelengths (J, H, K, 15, 6.7, 90 μm, 20 cm) and IRAS wavelengths (60, 100 μm). (Also see Dennefeld et al. 2005 for investigations into sources in the N1 field). In doing so we are able to gain a multiwavelength view of the nature of these interesting objects. We have compared their SEDs with those predicted by the radiative transfer models of Efstathiou and Rowan-Robinson (2003) to provide further insight into their properties.

The layout of this paper is as follows: Section 2 describes the multiwavelength data, Section 3 discusses the methods of associating the multiwavelength data with the 175 μm ISO sources, provides a summary of the results of this process and briefly describes the optical properties of the sources. The radiative transfer models are described in Section 4 and Secton 5 describes the comparison of the sources’ SEDs with predictions from the models. The resulting star formation rates, far–infrared luminosities and dust temperature estimations are given in Sections 6 and 7. Section 8 provides a summary of current evolutionary models, while conclusions and a discussion are provided in Section 9. An Appendix provides details of individual associations.

2 COMPLEMENTARY DATA

Optical associations were sought in r’ data from the INT– WFS (McMahon et al. 2001) which used the Wide Field

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 3

Figure 2. Normalised magnitude distribution of the N2 175 μm ISO source optical counterparts (r’–band) (solid line), dashed line gives the r’–band magnitude distribution of the INT-WFS catalogue for comparison.

Figure 3. Redshift distribution for the 30 175 μm sources with spectroscopic or photometric redshifts as listed in Table 1.

Camera (WFC) on the 2.5 m Isaac Newton Telescope at the Observatorio del Roque de Los Muchachos (La Palma, Spain). The WFC is formed by four 4k x 2k CCDs. The arrays have 13.5 μm pixels corresponding to 0.33 arcsec/pixel at the telescope prime focus and each one covers an area on the sky of 22.8 arcmin x 11.4 arcmin. The total sky coverage per exposure for the array is therefore 0.29 deg^2. Gaps between detectors are typically 20 arcsec and optical observaions are carried out allowing for a 10 per cent overlap between adjacent pointings for photometric purposes. The ELAIS-N2 optical field is approximately 9 deg^2. The survey has a typical completeness limit of 23 mag (Vega) in wavebands U, g’, r’, i’ and Z. However, there are no U–band data for our sources the N2 field. All optical magnitudes were calculated directly from the INT–WFS data.

Associations were then sought with sources in the multiwavelength ELAIS band-merged catalogue at 6.7, 15 and 90 μm with associated data at U,g’,r’,i’,Z,J,H,K and 20 cm (Rowan-Robinson et al. 2004) which by then had become available. This was a survey carried out using ISO covering a total of 12 deg^2 over five main fields, three in the north (N1, N2, N3) and two in the south (S1,S2). These areas were also surveyed at 20 cm with the Very Large Array (VLA) and AT. The separate wavebands making up the ELAIS survey each comprise an independent survey, the band–merged catalogue simply brings together the results of each of their final anayses, as described in Section 3.

Where detections were not found at 15 and 90 μm upper limits were extracted directly from the survey maps (Vaccari et al. 2004; Héraudeau et al. 2004) to a 3σ level using aperture photometry with an aperture size of 6 arcsec and 90 arcsec respectively. An aperture correction was applied to the 15 μm upper limits since 40 per cent of the point spread function (PSF) lies outside the aperture.

IRAS 100 and 60 μm fluxes or upper limits (3σ) were obtained at the galaxy optical positions using the IRAS Scan Processing and Inegration (SCANPI) internet facility^1 to provide extra constraints on the source SEDs.

Associations were also sought in the Submillimetre Common User Bolometer Array (SCUBA) 850 μm (Scott et al. 2002) and Max–Planck Millimeter Bolometer array (MAMBO) 1200 μm (Greve et al. 2004) catalogues within 10 and 3 arcsec of the optical position of the 175 μm counterpart, respectively. However, none were found for any of our 175 μm sources.

3 IDENTIFICATIONS: METHOD AND RESULTS

The positional accuracy of the ISO 175 μm sources was determined using simulated maps by Dole et al. (2001). Since 93 per cent of artificial sources brighter than 180 mJy in the simulated maps were recovered within a radius of 50 arcsec, associations were sought for the N2 sources within a 90 arcsec radius. This ensured the capture within the source error circle of the true source position for even faint source IDs. Associations were made using a likelihood ratio technique described in full in Mann et al. (2002). In brief, the likelihood ratio is the ratio of the probability of finding the true counterpart to a particular source at the source position with that magnitude to the probability of finding an object of the same magnitude there by chance. In terms of flux this takes the form:

LR = q(f)e(x, y)

n(f) (1) where q(f) is the flux probability distribution function for the source counterparts, e(x,y) is the probability distribution of positional offsets between the source and object and n(f) is the surface density of objects per unit flux interval. e(x,y) was taken to be a gaussian distribution with σ = 20 arcsec. This choice prevents too many objects being assigned moderate likelihood ratios, without excluding objects which should be considered or including objects which should not. The function q(f) is unknown for a new source population, as is the case here, and, as shown in Mann et al. (1997), an empirical estimate is very noisy for a small number of sources, q(f) was taken to be a constant. The probability, Pran, that

1 http://irsa.ipac.caltech.edu/applications/IRAS/Scanpi/

4 E. L. Taylor et al.

Figure 4. Examples of the affects of the radiative transfer model parameters on the resulting SEDs, see Section 4. Solid black line: A_V = 1, f_{SB} = 1, τ_v = 100 (comparison model). Black dotted line: A_V = 3, f_{SB} = 1, τ_v = 100. Dash-dot-dot-dot line: t_m = 0. Grey dashed line: A_V = 1, f_{SB} = 5, τ_v = 100. Dashed line: ψ = 10. Dash-dot line: τ = 8 × 10^{10} . Long dashed line: τ_{SB} = 80 Myrs. Solid grey line: τ_v = 200.

a fictitious, randomly-placed source would have a likeliest assocation with an optical object in the catalogue producing a likelihood ratio at least as high as the source-object pair in question was then calculated. Thus good associations have low values of Pran, corresponding to a high probability that the association is correct. The object with the lowest Pran was chosen as the source optical ID, with a cut off for non-association of Pran = 0.15. This is an arbitrary value chosen by inspection of the Pran distribution, see Figure 1. It is expected (Mann et al. 2002) that true IDs will cluster at low Pran values with a tail of objects reaching to high Pran values due to sources without good associations in the optical catalogue, as seen in the plot.

Counterparts were also sought in the band-merged ELAIS multiwavelength catalogue (Rowan-Robinson et al. 2004) using a search radius of 60 arcsec consistent, with the band merging procedure used in the collation of this catalogue. The individual wavelength ELAIS catalogues were merged, taking into account the different positional accuracies of each catalogue, sequentially as follows. The 15 μm and 20 cm catalogues (Vaccari et al. 2004; Ciliegi et al. 1999) were first identified with optical objects from the INT–WFS catalogue (González–Solares et al. 2003) and then merged according to their optical positions using a search radius of 2 arcsec. These were then matched with the 6.7 μm catalogue using a search radius of 5 arcsec and those 6.7 μm sources not merged were associated with optical counterparts. These were then merged with the 90 μm and 175 μm sources (Héraudeau et al. 2004; Dole et al. 2001) using search radii of 30 arcsec and 60 arcsec respectively. Where these were matched with more than one catalogue entry the less probable assocations were flagged in the catalogue. After this those sources that were still unmatched were associated with optical counterparts. These optical counterparts were sought by Rowan-Robinson et al. (2004) independently from our work and the resulting optical IDs were then compared.

In summary, we sought associations on the basis of applying the likelihood ratio method to the optical data alone, then, with the availablility of the final band-merged ELAIS catalogue, we reassessed them. Our final optical and ELAIS wavelength ID list was drawn up using the following criteria:

(i) If our optical ID, selected using the likelihood ratio method, agreed with the ELAIS optical ID to which the 175 μm flux had been assigned then both the ELAIS optical ID and band-merged data were accepted.

(ii) If the ELAIS optical ID had a Pran < 0.15 (cut off value see earlier) for association with the 175 μm ISO source then the ELAIS optical ID and band-merged data were accepted.

(iii) If our optical ID and ELAIS optical ID were in fact the same galaxy but had different entries in the INT–WFS catalogue due to the way the image analyser splits up bright galaxies into multiple sources, then the band-merged ELAIS data and optical ID were accepted.

(iv) If our optical ID had Pran < 0.15 but no optical ELAIS catalogue match then the source has optical and 175 μm data only (it may also have IRAS detections/upper limits and 60 μm and 90 μm upper limits)

(v) If our optical ID had Pran > 0.15 the source has no association

For sources in the main N2 FIRBACK catalogue (S > 180 mJy), which contains 27 detections, we made 22 confident optical associations with galaxies, 7 of which agree exactly with the ELAIS optical ID (category i.) and 6 for which we accepted the ELAIS optical ID (categories ii. or iii.). Nine confident optical associations were made for sources in the supplementary catalogue (S < 180 mJy, 28 sources), 2 of

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 5

Figure 5. 1σ starburst model parameter confidence region for f_{SB} and A_V for FN2 008. Possible models parameter combinations are shown with small crosses (note f_{SB} = 1 − 100 and A_V = 0 − 3 were allowed), the best-fitting model is marked with a square and the 1σ confidence region is shaded. A high resolution version of this figure is available at http://www.roe.ac.uk/∼elt/N2paper images.html .

which agreed with the ELAIS optical ID (category i.) and 2 of which where the ELAIS optical ID was accepted (categories ii. or iii.). There also were two sources in the supplementary catalogue with stellar IDs, one of which agreed with the ELAIS optical ID (category i.) and one of which was an accepted ELAIS optical ID (category ii. or iii.). The data for the identified sources are given in Table 1. and notes on individual sources are given in the Appendix, including Pran values of any other plausible identifications.

The identified sources were morphologically classified by visual inspection. We used i’ -band images from the INT–WFS, and followed the same classification method as Postman et al. (2005). The galaxies were classified using the classical Hubble sequence: E, E/S0, S0, S0/a, Sa, Sa/b, Sb, Sb/c, Sc, Irr. For the Advanced Camera for Surveys (ACS) on HST, for galaxies with redshift of around unity, visual classifications of this kind have a typical random error of 25 per cent, this reduces to 6 per cent when galaxies are classified in two broad cathegories: 1. early-type, 2. spirals and irregulars. These errors were estimated from the average scatter found in classifications by four ACS team members. The majority of our sources are spiral galaxies, we also have a number of S0 galaxies, 2 sets of interacting galaxies, 2 pairs and 2 irregulars, the morphology of 6 sources was unable to be deduced from the images.

Figure 2 shows the optical (r’ –band) magnitude distribution of the N2 175 μm ISO source optical counterparts compared to that of the overall INT-WFS catalogue. The source IDs are, in general, bright objects with apparent magnitudes ranging from 21 to as bright as 16.

Figure 3 shows the redshift distribution of the sources: they lie predominantly at z < 0.3 with only two sources having z > 0.5. Redshifts are discussed in more detail in Section 5.

Figure 6. 1σ starburst model parameter confidence region for f_{SB} and τ_v for FN2 008. Possible models parameter combinations are shown with small crosses (note f_{SB} = 1 − 100 and τ_v = 50 − 200 were allowed), the best-fitting model is marked with a square and the 1σ confidence region is shaded. A high resolution version of this figure is available at http://www.roe.ac.uk/∼elt/N2paper images.html .

Figure 7. 1σ starburst model parameter confidence region for A_V and τ_v for FN2 008. Possible models parameter combinations are shown with small crosses (note A_V = 0 − 3 and τ_v = 50 − 200 were allowed), the best-fitting model is marked with a square and the 1σ confidence region is shaded. A high resolution version of this figure is available at http://www.roe.ac.uk/∼elt/N2paper images.html .

4 RADIATIVE TRANSFER MODELS

It was initially attempted to fit the data to the GRASIL model SEDs of Silva et al. (1998). These provide six templates for nearby galaxies, three starbursts (Arp 220, M82 and NGC 6090) and three sprials (M100, M51 and NGC 6946). However, these templates did not describe the data well. Instead radiative transfer models of Efstathiou and Rowan-Robinson (2003) and Efstathiou et al. (2000) were employed to generate SED predictions for comparison with the data. These are able to

Table 1. Multiwavelength data for associated sources, fluxes in mJy.

nb. Sources listed with Pran greater than the threshold 0.15 due to falling into category (iii) (see Section 3) FN2 004 has Pran = 1.0 since the associated galaxy is mistakenly classified as a star in the INT WFS catalogue.

FIRBACK FIRBACK position optical position 175 μm Pran r’–mag 15 μm 6.7 μm 60 μm 90 μm 100 μm 20 cm zphot zspec morphological classification

FN2 000 16 37 33 +40 52 26 16 37 34.53 +40 52 11.2 2377±213 0.026 18.46 53.9±0.3 18.3±0.1 - 1461±36 - 8.74±0.02 - 0.03 irregular or edge–on spiral with tidal tail FN2 001 16 35 08 +40 59 20 16 35 07.87 +40 59 28.9 1251±139. 0.002 18.28 26.1±0.4 4.11±0.12 0.15±0.03 337±15 - 0.76±0.04 0.10 0.03 edge–on Sb/c FN2 002 16 36 10 +41 05 16 16 36 08.15 +41 05 07.7 803±102 0.086 19.33 8.9±0.1 2.3±0.1 0.41±0.02 614±37 - - 0.15 0.17 irregular with tidal tail FN2 003 16 35 25 +40 55 51 16 35 25.22 +40 55 42.1 682±92 0.001 17.45 13.9±0.1 5.5±0.1 0.19±0.03 416±19 - 1.70±0.02 0.17 0.03 Sa FN2 004 16 34 01 +41 20 49 16 34 01.82 +41 20 52.5 666±91 1.000 16.41 20.4±0.1 9.6±0.1 0.40±0.02 403±26 - 1.8±0.02 0.05 0.03 SBa FN2 005 16 32 43 +41 08 38 16 32 42.39 +41 08 46.1 522±78 0.011 18.67 6.1±0.2 2.1±0.1 0.16±0.03 399±27 - 0.67±0.04 0.02 0.26 Sa FN2 007 16 35 45 +40 39 14 16 35 46.91 +40 39 03.4 316±60 0.022 17.95 6.1±0.2 2.4±0.1 0.09±0.03 84±25 - 0.92±0.02 0.02 0.12 compact source with 2 nuclei FN2 008 16 35 47 +41 28 58 16 35 48.04 +41 28 30.3 293±58 0.084 18.32 4.5±0.1 1.3±0.1 0.12±0.03 74±18 - 0.38±0.01 0.10 0.14 Sb FN2 010 16 35 38 +41 16 58 16 35 36.16 +41 17 27.3 285±57 0.451 19.47 2.8±0.6 - 0.06±0.03 74.00±17 - 0.80±0.01 0.02 0.17 pair: irregular with tidal tail and Sa FN2 011 16 38 07 +40 58 12 16 38 08.78 +40 58 07.4 260±55 0.118 19.78 <1.97 - <0.12 <0.44 <0.26 - 0.51 - Sa? FN2 012 16 34 13 +40 56 45 16 34 11.98 +40 56 52.8 249±54 0.088 19.99 2.7±0.1 1.0±0.1 <0.08 83±10 - 0.51±0.01 0.07 0.14 Sa? FN2 015 16 36 07 +40 55 37 16 36 07.71 +40 55 47.1 223±51 0.015 18.64 5.5±0.1 1.2±0.1 <0.06 109±11 - 0.81±0.02 0.26 0.17 interacting galaxies: Sa/b and Sa FN2 016 16 34 26 +40 54 07 16 34 23.90 +40 54 10.0 218±51 0.191 19.88 3.1±0.1 1.0±0.1 0.06±0.03 <0.25 0.20±0.08 0.55±0.01 0.10 0.13 edge–on: type not clear FN2 017 16 34 44 +41 08 42 16 34 44.90 +41 08 20.6 213±50 0.030 18.46 2.2±0.7 - <0.10 <0.25 <0.18 - 0.18 - interacting galaxies: Sa with edge–on FN2 018 16 33 38 +41 01 15 16 33 37.23 +41 01 09.1 212±50 0.037 19.51 <2.98 - 0.08±0.03 <0.28 <0.19 - 0.15 - S0/a FN2 019 16 37 17 +40 48 36 16 37 16.80 +40 48 25.6 205±49 0.001 18.05 <3.99 - 0.06±0.04 <0.26 <0.18 - 0.10 0.03 Sb FN2 020 16 32 41 +41 06 10 16 32 40.50 +41 06 15.4 201±49 0.086 20.21 <6.58 - <0.07 <0.25 <0.11 - 0.15 - - FN2 021 16 37 58 +40 51 21 16 37 59.39 +40 51 15.8 196±49 0.001 17.57 <2.18 - <0.07 <0.19 <0.17 - 0.10 - - FN2 022 16 37 08 +41 28 26 16 37 08.21 +41 28 56.1 190±48 0.140 18.80 2.5±0.1 1.7±0.2 <0.10 <0.28 <0.23 0.56±0.02 0.05 0.17 Sa FN2 023 16 33 51 +40 49 44 16 33 51.65 +40 49 46.3 188±48 0.018 19.04 2.5±0.7 - <0.11 <0.28 <0.32 - 0.02 - Sb/c FN2 025 16 36 31 +40 47 38 16 36 31.23 +40 47 24.7 184±48 0.119 20.24 2.1±0.7 - 0.11±0.03 <0.33 0.11±0.07 - 0.20 - Sa CFN2 029 16 34 20 +41 06 54 16 34 19.46 +41 06 37.8 178±47 0.070 19.62 <4.36 - 0.06±0.02 <0.21 <0.24 - 0.15 - - CFN2 030 16 35 23 +40 38 42 16 35 22.81 +40 38 37.1 178±47 0.086 20.26 <3.66 - 0.06±0.03 <0.24 0.17±0.05 - 0.15 - S0/a CFN2 034 16 34 12 +40 46 26 16 34 12.52 +40 46 34.4 166±46 0.030 19.42 <2.61 - <0.08 <0.11 <0.10 - 0.55 - S0/a CFN2 036 16 37 01 +40 43 08 16 36 59.92 +40 42 46.6 165±46 0.119 19.40 <5.08 - 0.04±0.03 <0.25 <0.28 - 0.10 - Sa CFN2 038 16 34 32 +41 22 37 16 34 31.57 +41 22 45.7 161±45 0.023 19.26 1.8±0.1 - <0.08 <0.17 0.12±0.05 <0.15 0.02 0.14 Sb/c CFN2 039 16 36 13 +40 42 25 16 36 13.65 +40 42 30.0 160±45 0.001 17.15 5.9±0.2 2.5±0.1 0.11±0.00004 90±21 - 0.88±0.01 0.02 0.07 Sb CFN2 044 16 37 26 +40 45 39 16 37 25.93 +40 45 37.1 150±44 0.053 19.96 <2.87 - 0.02±0.05 <0.30 <0.14 - 0.05 - S0/a CFN2 047 16 34 51 +41 20 27 16 34 49.54 +41 20 49.2 147±44 0.125 19.16 2.4±0.1 1.3±0.1 <0.05 <0.20 <0.21 0.15±0.04 0.07 0.25 S0/a CFN2 049 16 37 42 +41 19 11 16 37 41.44 +41 19 14.8 143±44 0.210 20.87 1.9±0.2 - 0.09±0.03 74±24 - <0.15 0.51 - Sa?

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 7

Figure 8. 1σ non–starburst model parameter confidence region for A_V and ψ for FN2 001. Possible models parameter combinations are shown with small crosses (note A_V = 0 − 10 and ψ = 0.5 − 20.0 were allowed), the best-fitting model is marked with a square and the 1σ confidence region is shaded. A high resolution version of this figure is available at http://www.roe.ac.uk/∼elt/N2paper images.html .

model both cirrus and starburst emission or a combination of the two. The models used are briefly described below.

Ultraviolet to submillimetre emission from stars embedded in interstellar dust in galaxies known as the ’infrared cirrus component’ are modelled. The model consists of the input stellar radiation field, an interstellar dust model and the radiative transfer treatment of the interaction between the two which generates the output SED.

The input stellar radiation field is taken from the Galaxy Isochrone Synthesis Spectral Evolution Library (GISSEL, Bruzual and Charlot 1993 ). This gives the radiation from a mass of stars from the ultraviolet to near-infrared as a function of time.

Stars form in molecular clouds and at the early stages of their lives remain inside them during which time their radiation is absorbed by the dust and reprocessed to the infrared. During this phase of their life the model uses the code of Efstathiou et al. (2000) to compute the radiation emitted by stars and dust. The cloud is assumed to disperse 7.2 × 10^7 years after star formation. Before this, however, due to non-spherical evolution of the cloud, a fraction of the starlight f may have been able to escape without dust absorption. This occurs a time tm after star formation.

The radiation field within the galaxy is modelled to be due to a large number of randomly oriented molecular clouds whose average emission, for stars in the age range tm to 7.2 × 10^7 years, is approximately (1 − f)S^S_ν + fS^∗_ν were S^S_ν is the emission from a giant spherical molecular cloud (Efstathiou et al. 2000) and S^∗_ν is the emission from the stellar population (Bruzual and Charlot 1993). The emission of stars younger than tm is simply S^S_ν and those older than 7.2 × 10^7 years S^∗_ν . The fraction of general starlight that escapes the galaxy unattenuated is also parameterised in a ’leak’ variable.

The dust temperature is determined by the intensity of

Table 2. Parameter values

starburst non-starburst

τ 8 Gyrs 1 Myr t_{SB} galaxy age−t_m - galaxy age (universe age at z - 0.5 Gyrs) τ_{SB} 40 Myrs - leak 0.0 0.1 f 1.0 1.0 t_m 20 Myrs 3 Myrs A_V 0–3 0–10 τ_v 50–200 - ψ 5 0.5-20.0 f_{SB} 1–100 -

the stellar radiation field and is characterised in the model by the ratio of the bolometric intensity of the radiation field to that in the stellar radiation field in the solar neighbourhood (Mathis et al. 1983) , ψ. The star formation rate, ϕ̇∗(t), is assumed to have an exponential form with a time scale, τ , and a Salpeter IMF from 0.1 − 125 M⊙. ϕ̇_∗(t) ∝ e^{−t}τ In the case where a starburst is included the star formation rate is modified to ϕ̇^{SB}_∗ (t) ∝ ϕ̇_∗(t) + f_{SB} e^{−(t−tSB )}τ_{SB} where fSB is the ratio of the star formation rate at the peak of the starburst to that at time 0, tSB is the age of the galaxy at the start of the starburst and τSB is the exponential timescale of the starburst.

The interstellar dust model of Siebenmorgen and Kruegel (1992) is used, which models the effects of both small grains and PAHs. The opacity of the dust is characterised by AV , which controls the amount of UV to near-IR light absorbed by dust and re-emitted in the IR and sub–mm and therefore the ratio of the luminosity in these two bands. The model also has the ability to increase the dust extinction of the starburst component of the galaxy separately via the parameter τv , values of 50, 100, 150, 200 are suppported. In the starburst case a grid of models was produced over fSB , AV and τv and for non-starburst galaxies a grid of models was produced over AV and ψ. The values of the parameters used are given in Table 2.

The effects of each of the model parameters on the resulting SED is shown in Figure 4. The solid black line shows an SED produced using the fixed parameters (ψ = 5, τ = 8 × 10^9, tm = 20 Myrs, τSB = 40 Myrs) and fSB = 1, AV = 1, and τv = 100 for comparison. A model with increased dust extinction of AV = 3 is shown by the black dotted line: this increases the emission at longer wavelengths and decreases that in the optical, as would be expected. The dash-dot-dot-dot line shows a model with tm = 0 which dramatically changes the shape of the far–infrared peak due to the reduction in the amount of dust reprocessing of radiation from newly formed stars. However, any significant amount of time spent within a molecular cloud produces a far–infrared peak of shape similar to that of the other models shown. The peak of the SED is also increased significantly with an increase in the strength of the starburst, a model with fSB = 5 is shown by the grey dashed line. The other param-

8 E. L. Taylor et al.

eters do not affect the resulting SED vastly, hence, there are degeneracies and a spread of parameter values may result in a very similar SED. This is evidenced by models with ψ = 10 (dashed line), τ = 8 × 10^{10} (dash-dot), τSB = 80 Myrs (long dashes) and τv = 200 (solid grey line) all having very similar shaped SEDs. The parameter values chosen were in the mid-range of physically viable values as found by Efstathiou et al. (2000). The τv range covers values known to fit normal starbursts (τv = 50) (Efstathiou et al. 2000) to heavily obscured starbursts such as Arp 220 (τv = 200), this range was also used by Farrah et al. (2003) to fit a number of ULIRGs.

After fitting the models to the multiwavelength data, the parameter values for models within the 1σ χ^2 confidence limit of the best-fitting model were examined. The 1σ limit for starburst model fitted SEDs typically encompasses τv ± 50, AV ± 0.5 and fSB ± 1. There is also a correlation between fSB and AV such that models with higher fSB values require low AV values to fit the data. This is due to an increase in each of the parameters increasing the height of the far–infrared peak (as shown in Figure 4), therefore when both the parameters have high values the height of the peak is over–estimated. We also note that it is difficult to constrain τv since we do not have data in the region of the spectrum which it most affects. For non-starburst fitted SEDs the confidence region includes AV ±0.4 and ψ = 0−20. We also note that since the effect of ψ on the shape of the model SEDs is not marked, it is difficult to constrain this parameter and the 1σ confidence region encompasses the whole allowed parameter range. However, since it has little effect on the shape of the model SEDs this will not affect the property estimates calculated from the models. Examples of these confidence regions for both the starburst (FN2 008) and non-starburst (FN2 001) galaxies are shown in Figures 5 to 8.

5 SPECTRAL ENERGY DISTRIBUTIONS

We have compared the observed spectral energy distributions (SEDs) with predictions from the radiative transfer models of Efstathiou and Rowan-Robinson (2003) and Efstathiou et al. (2000) described in Section 4.

Spectroscopic redshifts were used in the fitting of the model SEDs, where available from the ELAIS catalogue (Rowan-Robinson et al. 2004) or elsewhere. In other cases photometric redshifts were drawn from the ELAIS catalogue, and calculated bespoke by ImpZ (Babbedge et al. 2004) for the remainder. We note that since photometric redshifts are typically accurate to about 10 per cent in (1 + z), for the spectroscopic redshifts we have available this implies an accuracy of around 0.11 to 0.14. Therefore, given that the solutions are based on a maximum of four optical bands, the agreement between our photometric and spectroscopic redshifts is reasonable, the largest margin of error being about 20 per cent in (1 + z). It is also important to note that there are no catastrophic outliers which can occur due to degeneracies in the solution space of photometric codes. These small redshift errors do not affect the fitted SEDs significantly and the resulting errors on derived properties are much smaller than those incurred by the 1σ error

Table 3. Parameters for the starburst radiative transfer model SEDs fitted to the N2 175 μm ISO source SEDs.

FIRBACK A_V f_{SB} τ_v

FN2 002 0.4 2.0 150 FN2 003 0.3 1.0 200 FN2 004 0.0 1.0 200 FN2 005 0.0 2.0 100 FN2 007 0.2 2.0 200 FN2 008 0.0 2.0 150 FN2 010 0.3 3.0 200 FN2 011 0.5 3.0 200 FN2 012 0.0 3.0 100 FN2 016 0.3 2.0 200 FN2 017 0.4 1.0 200 FN2 018 0.0 2.0 200 FN2 019 0.0 1.0 200 FN2 021 0.0 1.0 150 FN2 022 0.1 1.0 150 FN2 025 0.8 3.0 150 CFN2 029 1.1 10.0 200 CFN2 030 0.9 2.0 200 CFN2 034 1.0 1.0 50 CFN2 038 0.0 1.0 150 CFN2 039 0.0 1.0 100 CFN2 044 0.0 4.0 150 CFN2 047 0.0 1.0 50 CFN2 049 0.1 5.0 50

Table 4. Parameters for the quiescent radiative transfer model SEDs fitted to the N2 175 μm ISO source SEDs.

FIRBACK A_V ψ

FN2 000 10.0 20.0 FN2 001 0.4 17.0 FN2 015 1.1 20.0 FN2 020 3.7 0.5 FN2 023 0.2 0.5 CFN2 036 1.0 0.5

on the fitted SED χ^2 value which are given for all derived quantities.

The N2 175 μm ISO source SEDs are shown in Figures 9 and 10. They appear to fall into two population categories, the first being star bursting galaxies with their starburst region at a high optical depth (fitted model parameters shown in Table 3 and SEDs plotted in Figure 9) and the second dust obscured galaxies with quiescent star formation (fitted model parameters shown in Table 4 and SEDs plotted in Figure 10).

6 STAR FORMATION RATES AND

FAR–INFRARED LUMINOSITIES

Star formation rates for the sources were calculated using both an optical U-band estimate (Cram et al. 1998) and a FIR estimate (Kennicutt 1998), given in equations 2 and 3.

SFRU (M ≥ 5 M⊙) = LU 1.5 × 10^{22} W Hz^{−1}

100 M⊙yr^{−1} (2)

SFRFIR = 4.5 × 10^{−44} LFIR(ergs s^{−1}) M⊙yr^{−1} (3)

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 9

Figure 9. N2 ISO 175 μm sources fitted model SEDs. Best-fitting starburst models (solid line) and cirrus models (dashed line) are shown for each source.

10 E. L. Taylor et al.

Figure 9 – continued N2 ISO 175 μm sources fitted model SEDs. Starburst models (solid line) and cirrus models (dashed line) are shown.

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 11

Figure 9 – continued N2 ISO 175 μm sources fitted model SEDs. Starburst models (solid line) and cirrus models (dashed line) are shown.

12 E. L. Taylor et al.

Figure 10. N2 ISO 175 μm sources fitted model SEDs. Cirrus models (solid line) and starburst models (dashed line) are shown.

Where LU is the U-band luminosity, estimated through interpolation of the SED models and LFIR is the integrated infrared luminosity over 8–1000 μm. These both assume a Salpeter IMF. The chosen IMF affects the estimated star formation rates since we integrate over only a portion of the luminosity of the galaxy’s constituent stars. The proportion of stars emitting with luminosities in the range in question will depend on the initial mass function, since it describes the initial distribution of stellar luminosities over the range, as discussed by Mann et al. (2002). The star formation rates for individual sources can be seen in Table 5. The distribution of FIR star formation rates and a comparison between those estimated using both the FIR and U–band luminosities can be seen in Figure 11. There is a large spread in star formation rates with a number of galaxies with SEDs suggestive of a modest starburst. This implies that these galaxies are of low mass since their existing stellar population is dominated by the small starburst at infrared wavelengths. Using star formation rates estimated for SED models falling in the 1σ χ^2 range (see Section 4) the U–band and FIR SFRs are estimated to be accurate to 25 per cent and 50 per cent respectively. It can be seen in the lower pannel of Figure 11 that the FIR star formation rate estimates are significantly higher, typically by a factor of 4, than those using the U–band estimate. This is to be expected for such highly obscured objects.

The integrated far–infrared luminosities over the wavelength range 8-1000 μm were estimated. Results can be seen in Table 5 and a distribution in Figure 12. These are estimated to be accurate to approximately 25 per cent.

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 13

Table 5. Star formation rates and FIR luminosities of the starburst galaxies (first block) and cirrus galaxies (second block).

FIRBACK U–band SFR FIR SFR L_{F IR} z M_⊙yr^{−1} M_⊙yr^{−1} L_⊙

FN2 002 36.9 93.1 4.87 × 10^{11} 0.17 FN2 003 3.8 3.6 1.83 × 10^{10} 0.03 FN2 004 9.4 5.4 2.85 × 10^{10} 0.03 FN2 005 131.4 169.1 9.18 × 10^{11} 0.26 FN2 007 22.3 39.5 2.07 × 10^{11} 0.12 FN2 008 24.4 27.3 1.46 × 10^{11} 0.14 FN2 010 21.7 88.9 4.68 × 10^{11} 0.17 FN2 011 104.8 391.9 2.04 × 10^{12} 0.51 FN2 012 6.3 13.1 7.07 × 10^{10} 0.14 FN2 016 12.6 25.6 1.33 × 10^{11} 0.13 FN2 017 32.5 28.1 1.41 × 10^{11} 0.18 FN2 018 8.4 12.2 6.53 × 10^{10} 0.15 FN2 019 1.7 1.0 5.22 × 10^9 0.03 FN2 021 7.9 4.8 2.59 × 10^{10} 0.10 FN2 022 32.6 22.3 1.18 × 10^{11} 0.17 FN2 025 5.8 39.7 2.07 × 10^{11} 0.20 CFN2 029 0.1 7.2 3.79 × 10^{10} 0.15 CFN2 030 3.2 16.8 8.60 × 10^{10} 0.15 CFN2 034 138.2 296.6 1.48 × 10^{12} 0.55 CFN2 038 25.6 11.6 6.19 × 10^{10} 0.14 CFN2 039 7.7 4.1 2.23 × 10^{10} 0.07 CFN2 044 0.4 1.8 9.41 × 10^9 0.05 CFN2 047 63.2 27.2 1.49 × 10^{11} 0.25 CFN2 049 49.1 252.8 1.39 × 10^{12} 0.51

FN2 000 2.8 7.9 3.97 × 10^{10} 0.03 FN2 001 9.3 1.7 8.37 × 10^9 0.03 FN2 015 29.1 18.8 9.58 × 10^{10} 0.17 FN2 020 3.0 7.5 2.56 × 10^{10} 0.15 FN2 023 1.1 0.1 3.87 × 10^8 0.02 CFN2 036 4.3 2.5 8.82 × 10^9 0.10

7 DUST TEMPERATURES AND MASSES

The dust in the galaxy radiative transfer models is at a range of temperatures, however, we computed an emissionweighted estimate via the fitting of a grey body to the far– infrared portion of the SED (from the peak of the SED to 1000 μm) as follows:. Fν ∝ ν^{β+3} e^{hν}kT − 1 (4) In equation 4 T is the dust temperature which controls the position of the maximum of the long wavelength SED, β is the frequency dependence of the dust grain emissivity and controls the gradient of the long wavelength slope of the grey body curve. Fitting over this wavelength range allows us to constrain both the temperature and β, without reaching the far–infrared where the dust may go optically thick and no longer be well described by a greybody model. The derived values for the sources can be seen in Table 6. Using the method described above (Section 6) for the starburst models these are estimated to be accurate to T±3 K and β ± 0.5, in the non-starburst case these estimates are accurate to T±14 K and β ± 0.1.

The distribution of the dust temperatures for the N2 175 μm ISO source galaxies is shown in Figure 13. The starburst galaxy dust temperatures are slightly higher than those found by Sajina et al. (2003) (∼ 20 − 30 K) for a sam-

Table 6. Greybody parameters and dust masses for the starburst galaxies (first block) and cirrus galaxies (second block).

FIRBACK T (K) β M_{dust}(M_⊙)

FN2 002 40 1.4 8.0 × 10^7 FN2 003 36 1.5 4.3 × 10^6 FN2 004 41 1.9 1.4 × 10^6 FN2 005 40 1.9 2.9 × 10^7 FN2 007 42 1.5 2.5 × 10^7 FN2 008 39 1.9 6.5 × 10^6 FN2 010 45 1.4 5.4 × 10^7 FN2 011 41 1.4 2.5 × 10^8 FN2 012 39 1.9 3.0 × 10^6 FN2 016 42 1.4 2.1 × 10^7 FN2 017 36 1.4 3.9 × 10^7 FN2 018 39 2.0 2.4 × 10^6 FN2 019 41 1.9 2.5 × 10^5 FN2 021 41 1.9 9.9 × 10^5 FN2 022 41 1.6 1.0 × 10^7 FN2 025 40 1.3 4.5 × 10^7 CFN2 029 49 1.2 5.6 × 10^6 CFN2 030 38 1.3 2.5 × 10^7 CFN2 034 35 1.1 6.5 × 10^8 CFN2 038 40 1.9 2.6 × 10^6 CFN2 039 40 1.9 9.2 × 10^5 CFN2 044 41 1.9 4.2 × 10^5 CFN2 047 41 1.7 6.6 × 10^6 CFN2 049 44 1.5 6.6 × 10^7

FN2 000 31 1.9 7.2 × 10^6 FN2 001 30 1.9 1.7 × 10^6 FN2 015 31 1.9 1.4 × 10^7 FN2 020 17 1.8 1.6 × 10^8 FN2 023 16 2.0 2.0 × 10^6 CFN2 036 17 1.8 5.1 × 10^7

ple of N1 ISO 175 μm sources but have similar emissivity coefficients: Sajina et al. (2003) found β ∼ 1.5 − 1.7.

Dust masses were estimated using the submillimetre prescription (Hildebrand 1983) at a rest wavelength of 450 μm: M_{dust} = Sν_0 D^2_L (1 + z)κ(νr)B(νr, T_{dust}) (5) κ(νr ) = 0.067 ( ν_r 2.5 × 10^{11} )_β (6) where ν0 and νr are the observed and rest frame frequencies respectively, Sν_0 is the observed flux at ν0, estimated through interpolation of the SED models, and B(νr , T_{dust}) is the Planck function in the rest frame. T_{dust} and β are the dust temperature and dust grain emissivity estimated via the greybody fitting. κ(νr ) is known as the mass absorption coefficient and has units of m^2kg^{−1}. This approach assumes that the galaxy is optically thin at submillimetre wavelengths. Resulting dust masses, calculated at a wavelength of 450 μm (accurate to approximately 25 per cent), are shown in Table 6. We note that the dust masses follow the trend of the far–infrared luminosities and star formation rates, those with high SFRs and LFIR having larger dust masses.

14 E. L. Taylor et al.

Figure 11. Top window:Far–infrared star formation rate distribution (M_⊙yr^{−1}) for the ISO 175 μm sources, see Table 5. Bottom window: Far–infrared starformation rate estimates vs. u-band starformation rate estimates.

Figure 12. Distribution of far–infrared luminosities (L_⊙) for the ISO 175 μm sources, see Table 5.

8 EVOLUTIONARY MODELS

The detection of the far–infrared background in 1996 led to a re–evaluation of galaxy evolution models. One of the earliest new models to emerge was that of Burigana et al. (1997) which used the FIRB to place constraints on models for the cosmic star formation history and therefore the production of the background signal. This paper concluded that stellar nucleosynthesis is able to account for a FIRB intensity not far from the upper limit set by the COBE detection. It also suggested substantially higher star formation rates at higher redshifts than suggested by optical data.

It is now fairly well established that infrared–selected

Figure 13. Distribution of dust temperatures for the ISO 175 μm sources, see Table 6.

galaxies undergo extremely high rates of evolution compared to measurements at other wavelengths over the approximate redshift range 0 < z < 1. Chary and Elbaz (2001) models imply that about 80 per cent of the cosmic infrared background was produced between 0 < z < 1.5 compared to only 30 per cent of the 850 μm background. Also the dust enshrouded star formation rate peaks at z ∼ 0.8 at a value of ∼ 0.25 M⊙yr^{−1}Mpc^{−3} and at least 70 per cent of this star formation takes place in infrared luminous galaxies with LIR > 10^{11} L⊙. In fact ∼ 75 per cent of 15 μm sources examined by Elbaz et al. (2002) were found to be in this category of luminous infrared galaxies and have star formation rates of ∼ 100 M⊙yr^{−1}. The comoving density of infrared light due to these galaxies was over 40 times larger at z ∼ 1 than it is today.

Models of the cosmic infrared background produced by Lagache et al. (2003), that are able to fit number counts and unresolved anisotropies imply that the luminosity function must change dramatically with redshift. These also show rapid evolution of high luminosity sources up to z=1. It has been suggested that this strong evolution is due to bimodal star formation, one long lived quiescent, passive phase and one enhanced starburst phase triggered by interactions and mergers (e.g. Lagache et al. 2003, Franceschini et al. 2001). Franceschini et al. (2001) also suggest that the interpretation of evolution with redshift could be biased due to an increase in the probability of detecting a galaxy during an active phase caused by both an increase of the rate of interactions, in part due to the geometry of the expanding universe, and an increase of the infrared luminosity due to more abundant fuel available in the past.

However, Chapman et al. (2002) point out that at z < 1 the coldest and most dusty galaxies will have the greatest flux densities for an equivalent infrared luminosity. At z > 1 the FIRBACK 175 μm detection will lie bluewards of the peak in the restframe black body spectrum and dust temperatures of < 100 K will no longer have significant effects on the observed flux. Therefore at higher redshifts, the flux limited FIRBACK survey will be biased towards cooler galaxies.

Models such as Franceschini et al. (2001) and

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 15

Chary and Elbaz (2001) do not explicitly incorporate such cold luminous galaxies which are preferentially selected in our survey for z < 1. Chapman et al. (2002) examined two of the 175 μm selected ISO sources and indentified them as unusually cold ULIRGs with dust temperatures of ∼ 30 K which is significantly lower than the usual ULIRG dust temperature of ∼ 50 K. Cold, dusty yet luminous objects suggest large masses of dust heated at a moderate intensity. The existence of such sources may seriously affect the interpretation of SCUBA sources if they are numerous at high–z. Since many models rapidly evolve a hot ULIRG population to the local luminosity function they may predict a false redshift distribution if these cold sources are not considered.

9 DISCUSSION AND CONCLUSIONS

We have found bright galaxy optical identifications for 31 out of the 55 N2 ISO 175 μm sources and stellar identifications for 2 sources. 17 of those with galaxy optical IDs were associated with sources from the band-mergerd ELAIS catalogue. We then compard the spectral energy distributions of the sources with predictions from the radiative transfer models of Efstathiou and Rowan-Robinson (2003) and Efstathiou et al. (2000).

22 of the 175 μm sources have not been confidently associated with optical counterparts and therefore their nature is still unknown. However, only 4 of these sources are in the main FIRBACK catalogue, the remaining 18 are listed in the complementary catalogue which contains detections at lower signal to noise and therefore they may just be spurious detections. However, these could also be due to sources having multiple IDs or them being associated with heavily extincted objects which were not in the optical catalogue.

24 galaxies have been classed as star bursting. They have a range of far–infrared luminosities from 10^9 L⊙ to 10^{12} L⊙ corresponding to a range of star formation rates from ∼ 0.1 to ∼ 400 M⊙yr^{−1}. Although those at the lower end of this range are not forming stars at a dramatic rate their small starburst component is dominating over the existing population at far–infrared wavelengths. This implies that the 175 μm FIRBACK sample contains a significant number of low mass galaxies. The majority of these galaxies are spirals and a number are S0 galaxies.

Sources FN2 005, 011, CFN2 034 and CFN2 049 have LFIR ∼ 10^{12} L⊙ and high star formation rates, we therefore suggest that these are in the low redshift tail of the rapidly evolving ULIRG population. This is in agreement with the findings of Sajina et al. (2003) who found one sixth of their 175 μm sample to fall into this category. We also suggest that those galaxies with moderate star formation rates and far– infrared luminosities of ∼ 10^{11} L⊙ at moderate z (≥ 0.12) are LIRGs (FN2 002, 007, 008, 010, 016, 017, 022, 025 and CFN2 047). Those with z ≤ 0.12 are more normal galaxies perhaps with lower masses (FN2 003, 004, 012, 018, 019, 021, CFN2 029, 030, 038, 039, 044).

The estimated dust temperatures of the starburst galaxies are 30-49 K which is relatively low compared to that of standard ULIRGs which have TD ∼ 50 K. The most luminous of these galaxies also have large dust masses adding weight to the suggestion that cold, dusty, luminous objects have large masses of dust heated at a moderate intensity (Chapman et al. 2002).

A further 6 sources have non-starburst SEDs. These sources have far–infrared luminosities of 10^8 − 10^{10} L⊙ and star formation rates of < 30 M⊙yr^{−1}. We suggest that these are quiescently star forming galaxies (FN2 000, 001, 015, 020, 023, 036). These galaxies have low dust temperatures of 16−31 K and dust masses of 10^6 −10^8 M⊙. 3 of these galaxies are spirals, 1 is an intereacting galaxy pair, 1 is either an irregular or a spiral with tidal tail and the morphology of the remaining source was unable to be deduced.

Lagache et al. (2003) predicted 62 per cent of 175 μm sources would have z < 0.25 and the remainder 0.8 < z < 1.2. We find only one 175 μm source with S > 180 mJy with z > 0.25 and therefore have ≫ 62 per cent with z < 0.25. However, our mix of higher redshift ULIRGs and lower redshift starburst galaxies is in good qualitative agreement with the predictions of the Lagache et al. (2003) starburst templates as adopted by Sajina et al. (2003). Lagache et al. (2003) also state that to gain agreement between their models and observations they require a cold local population which is what has been found.

There has also been recent investigation into the submillimetre properties of the local universe through the SCUBA Local Universe Galaxy Survey (Dunne and Eales 2001; Dunne et al. 2000). This survey found a population of galaxies with LFIR = 10^{10} − 10^{11} L⊙ and dust masses of 10^7 − 10^8 M⊙. The population was fitted with a twocomponent dust model to discover cold dust temperatures of ∼ 21 K and hot dust temperatures of 30−50 K. It is clear that the local 175 μm FIRBACK population has very similar properties to these galaxies. The sources of the far–infrared background are therefore offering a stepping stone between high redshift SCUBA galaxies and the local universe.

10 ACKNOWLEDGEMENTS

E. L. Taylor acknowledges support from a PPARC studentship. Ph. Héraudeau acknowledges support from the EU TMR Network “SISCO” (HPRN-CT-2002-00316). S. Mei thanks Marc Postman for insights on the galaxy morphological classification. We thank an anonymous referee for a thorough reading of our paper which significantly improved the presentation of its results.

REFERENCES

Babbedge T. S. R. et al., 2004, MNRAS, 353, 654 Blain, A. W., Smail, I., Ivison, R. J., Kneib, J.-P., 1999, MNRAS, 302, 632 Bruzual A., G. and Charlot, S., 1993, ApJ, 405, 538 Burigana, C., Danese, L., de Zotti, G., Franceschini, A., Mazzei, P., Toffolatti, L., 1997, MNRAS, 287, L17 Chapman, S. C., Smail, I., Ivison, R. J., Helou, G., Dale, D. A., and Lagache, G., 2002, ApJ, 573, 66 Chary, R. and Elbaz, D., 2001, ApJ, 556, 562 Ciliegi, P. et al., 1999, MNRAS, 302, 222 Cram, L., Hopkins, A., Mobasher, B., and Rowan- Robinson, M., 1998, ApJ, 507, 155 Dennefeld, et al., 2005, A&A, submitted

16 E. L. Taylor et al.

Dole, H. et al., 1999, usis.conf.1031D Dole, H. et al., 2001, A&A, 372, 364 Dunne, L., Eales, S., Edmunds, M., Ivison, R., Alexander, P., and Clements, D. L., 2000, MNRAS, 315, 115 Dunne, L. and Eales, S. A., 2001, MNRAS, 327, 697 Efstathiou, A. and Rowan-Robinson, M., 2003, MNRAS, 343, 322 Efstathiou, A., Rowan-Robinson, M., and Siebenmorgen, R., 2000, MNRAS, 313, 734 Elbaz, D., Cesarsky, C. J., Chanial, P., Aussel, H., Franceschini, A., Fadda, D., and Chary, R. R., 2002, A&A, 384, 848 Farrah, D., Afonso, J., Efstathiou, A., Rowan-Robinson, M., Fox, M., Clements, D., 2003, MNRAS, 343, 585 Franceschini, A., Aussel, H., Cesarsky, C. J., Elbaz, D., and Fadda, D., 2001, A&A, 378, 1 González–Solares E. et. al., 2003, MNRAS, submitted astro-ph/0402406 Greve, T. R., Ivison, R. J., Bertoldi, F., Stevens, J. A., Dunlop, J. S., Lutz, D., Carilli, C. L., 2004, MNRAS, 354, 779 Hacking, P. B. and Soifer, B. T., 1991, ApJ, 367, 49 Héraudeau, Ph. et al., 2004, MNRAS, 354, 924 Hildebrand, R. H., 2004, QJRAS, 24, 267 Kennicutt, R. C., 1998, ARA&A, 36, 189 Kessler, M. F. et al., 1996, A&A, 315, L27 Lagache, G., Dole, H., and Puget, J.-L., 2003, MNRAS, 338, 555 Lawrence, A. et al., 1999, MNRAS, 308, 897 Lemke, D. et al., 1996, A&A, 315, 64 Lonsdale, C. J., Hacking, P. B., Conrow, T. P., Rowan- Robinson, M., 1990, ApJ, 358, 60 Madau, P., Pozzetti, L., and Dickinson, M., 1998, ApJ, 498, 106 Mann, R. G. et al., 1997, MNRAS, 289, 482 Mann, R. G. et al., 2002, MNRAS, 332, 549 Mathis, J. S., Mezger, P. G., and Panagia, N., 1983, A&A, 128, 212 McMahon, R. G., Walton, N. A., Irwin, M. J., Lewis, J. R., Bunclark, P. S., Jones, D. H., 2001, NewAR, 45, 97M Oliver, S. J. and Rowan-Robinson, M. and Saunders, W., 1992, MNRAS, 256, 15 Partridge, R. B., Peebles, P. J. E., 1967, ApJ, 148, 377 Patris, J., Dennefeld, M., Lagache, G., Dole, H., 2003, A&A, 412, 349 Postman, M. et al., 2005, ApJ, submitted Puget, J.-L., Abergel, A., Bernard, J.-P., Boulanger, F., Burton, W. B., Desert, F.-X., and Hartmann, D., 1996, A&A, 308, L5+ Rowan-Robinson, M. et al., 2004, MNRAS, 351, 1290 Sajina, A., Borys, C., Chapman, S., Dole, H., Halpern, M., Lagache, G., Puget, J.-L., and Scott, D., 2003, MNRAS, 343, 1365 Scott, S. E. et al., 2002, MNRAS, 331, 817 Siebenmorgen, R. and Kruegel, E., 1992, A&A, 259, 614 Silva, L., Granato, G. L., Bressan, A., Danese, L., 1998, ApJ, 509, 103 Soifer, B. T., Neugebauer, G., Houck, J. R., 1987, ARA&A, 25, 187 Sunyaev, R. A., Tinsley, B. M., Meier, D. L., 1978, CompAp, 7, 183

Vaccari, M. et al., 2004, MNRAS, submitted astro-ph/0404315

11 APPENDIX

Notes on the multiwavelength associations for individual sources. Images of each of the sources are shown in Figure 14. FN2 - 000: Identification with a bright optical galaxy (Pran = 0.026, r’ magnitude = 18.5, zspec = 0.03, irregular or edge–on spiral with tidal tail). This is also an ELAIS source (ELAISC15_J163734.4+405208) optical ID with detected emission at 15, 6.7, 90 μm and radio detected emission at 20 cm. There are two other ELAIS sources (ELAISC15_J163729.3+405248,

ELAISC15_J163731.3+405156) within the FIRBACK error

ellipse with optical IDs with associated Pran values of 0.604 and 0.246.

FN2 - 001: Identification with a bright optical galaxy (Pran = 0.002, r’ magnitude = 18.3, z_{phot} = 0.10, edge–on Sb/c). This is also an ELAIS source (ELAISC15_J163507.7+405929) optical ID with detected emission at 15, 6.7, 90 μm and radio detected emission at 20 cm. This also has an IRAS detection at 60μm.

FN2 - 002: Identification with an optical galaxy (Pran = 0.078, r’ magnitude = 19.3). An ELAIS source ID (ELAISC15_J163608.1+410507) has an optical ID with the same galaxy, however, they are different entries in the INT catalogue caused by the splitting up of bright objects by the image analyser. The ELAIS ID has Pran = 0.086, zspec = 0.17, it is an irregulare galaxy with a tidal tail and detected has emission at 15, 6.7 and 90 μm. This also has an IRAS detection at 60 μm. There are two other ELAIS sources (ELAISC15_J163608.4+410529,

ELAISC15_J163611.6+410452) within the FIRBACK error

ellipse with optical IDs with associated Pran values of 0.885 and 0.983.

FN2 - 003: Identification with a bright optical galaxy (Pran = 0.001, r’ magnitude = 17.5, zspec = 0.03, Sa). This is also an ELAIS source (ELAISC15_J163525.1+405542) optical ID with detected emission at 15, 6.7, 90 μm and radio detected emission at 20 cm. This also has an IRAS detection at 60 μm.

FN2 - 004: This ID is a small optical galaxy (Pran = 0.079, r magnitude = 20.2). However, there is also present another large bright galaxy (r magnitude = 16.4) which is mistakenly classified as a star so is forcably not associated and assigned a Pran of 1.0. Previous associations allowing ISO 175 μm sources to be associated with stars chose this ID which matches with the optical ID of an ELAIS source (ELAISC15_J163401.8+412052) which has zspec = 0.03 and detected emission at 15, 6.7, 90 μm and radio emission at 20 cm and has the morphology of a SBa. This also has an IRAS detection at 60 μm.

FN2 - 005: Identification with bright optical galaxy (Pran = 0.011, r magnitude = 18.7, zspec = 0.26, Sa). This is also an ELAIS source (ELAISC15_J163242.4+410847) optical ID with detected emission at 15, 6.7, 90 μm and radio emission at 20 cm. This also has an IRAS detection at 60 μm. There is another ELAIS source

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 17

Figure 14. Optical INT images of the N2 ISO 175 μm sources. FIRBACK source position marked with a diamond (axes show distance from source position in arcsec), optical ID marked with a cross, ELAIS positions marked with small circles, ELAIS optical IDs marked with pluses. A 90 arcsec circle is plotted to show the region in which optical IDs were searched for. Figure available from http://www.roe.ac.uk/∼elt/N2paper images.html.

(ELAISC15_J163244.6+410911) within the FIRBACK error ellipse with an optical ID with an associated Pran of 0.315.

FN2 - 006: Identification with what appears on the image to be a pair of interacting galaxies (Pran = 0.001, r’ magnitude = 18.2, no redshift). An ELAIS source (ELAISC15_J163506.1+411038) appears to be on the same object, however, is does not have an optical ID. There is another ELAIS source (ELAISC15_J163503.5+411137) within the FIRBACK error ellipse.

FN2 - 007: Identification with bright compact source with two nuclei (Pran = 0.022, r magnitude = 18.0, zspec = 0.12). This is also an ELAIS source (ELAISC15_J163546.9+403903) optical ID with detected emission at 15, 6.7, 90 μm and radio emission at 20 cm. This also has an IRAS detection at 60 μm. There is another ELAIS source (ELAISC15_J163545.5+403825) within the FIRBACK error ellipse with an optical ID with an associated Pran of 0.998.

FN2 - 008: Identification with an optical galaxy (Pran = 0.053, r’ magnitude = 18.4). However, the 175 μm flux has been assigned in the ELAIS catalogue to a source (ELAISC15_J163548.0+412829) with a different optical ID. This ID has Pran = 0.084 for association with the FIRBACK source and is therefore a possible identification. The ELAIS source has zspec = 0.14 and detected emission at 15, 6.7, 90 μm and radio emission at 20 cm, it is an Sb galaxy. This also has an IRAS detection at 60 μm.

FN2 - 009: This source does not have a confident optical identification. It is best associated with a galaxy with Pran = 0.440, this does not agree with the optical ID for the ELAIS source (ELAISC15_J163359.2+405303, Pran = 0.880, r’ magnitude=18.8) to which the 175 μm flux has been assigned, this source also has detected emission at 15, 6.7, 90 μm and radio emission at 20 cm. This source is confidently identified as a star when stellar associations are allowed with Pran = 0.142 (the threshold for these associations is Pran = 0.4), however, this still does not agree with the ELAIS optical ID.

FN2 - 010: Identification with a pair of interacting galaxies, an irregular with a tidal tail and an Sa (Pran = 0.114, r’ magnitude = 18.8). An ELAIS source (ELAISR163536+411726) ID has an optical ID with the same galaxy, however, they are different entries in the INT catalogue caused by the splitting up of bright objects by the image analyser. The ELAIS source has zspec = 0.17 and detected emission at 90 μm and radio emission at 20 cm. This also has an IRAS detection at 60 μm.

FN2 - 011: Identification with an optical galaxy (Pran = 0.118, r’ magnitude = 19.8, z_{phot} = 0.51, Sa?). However, the 175 μm flux has been assigned in the ELAIS catalogue to a source (ELAISR163809+405839T) with a different galaxy ID (r magnitude = 18.6) and detected emission only in the far–infrared and radio. This has a Pran value of 0.547 for association with the FIRBACK source, it is therefore not an acceptable association.

FN2 - 012: Identification with an optical galaxy (Pran = 0.006, r’ magnitude = 18.5). However, the 175 μm flux has been assigned in the ELAIS catalogue to a source (ELAISC15_J163412.0+405652) with a different galaxy ID (r magnitude = 20.0). This ID has Pran = 0.088 for association with the FIRBACK source and is therefore a possible identification. The ELAIS source has zspec = 0.14 and detected emission at 15, 6.7, 90 μm and radio emission at 20 cm, it is possibly an Sa. There are two other ELAIS sources (ELAISC15_J163417.4+405710,

ELAISC15_J163417.9+405653) within the FIRBACK error

ellipse with optical IDs with associated Pran values of 0.990 and 1.000.

FN2 - 013: This source does not have a confident optical identification. It is best associated with an optical galaxy (Pran = 0.260, r’ magnitude = 20.4). This is also an ELAIS source (ELAISC15_J163406.5+405106) optical ID with detected emission at 15 μm.

FN2 - 014: This source appears in the ELAIS 90 and 175 μm unassociated catalogue (ELAIS-FBK175_N2_014). It does not have a confident optical identification.

FN2 - 015: Identification with a pair of interacting galaxies, an Sa/b and an Sa, (Pran = 0.015, r magnitude = 18.6, zspec = 0.17). This is also an ELAIS source (ELAISC15_J163607.7+405546) optical ID with detected emission at 15, 6.7, 90 μm and radio emission at 20 cm.

FN2 - 016: Identification with an edge–on optical galaxy whose morphological type is unclear (Pran = 0.119, r’ magnitude = 20.0). An ELAIS source (ELAISC15_J163423.9+405410) ID has an optical ID with the same galaxy, however, they are different entries in the INT catalogue caused by the splitting up of bright objects by the image analyser. This source has zspec = 0.13 and detected emission at 15, 6.7 μm and radio emission at 20 cm. This also has IRAS detections at 60 and 100 μm. There are two other ELAIS sources (ELAISC7_J163421+405413,

ELAISC7_J163423+405506) within the FIRBACK error

ellipse one with an optical ID with Pran = 1.000, the other has no optical ID.

FN2 - 017: Identification with a pair of interacting galaxies, an Sa and an edge–on spiral, (Pran = 0.030, r’ magnitude = 18.5, z_{phot} = 0.18). The 175 μm flux is assigned to an ELAIS source (ELAISR163442+410759) with a galaxy ID with associated Pran = 1.000, it is very faint and far from the source. There is, however, another ELAIS source (ELAISR163445+410817) present, with detected emission only in the radio, in the error ellipse without an optical ID which is only about 5arcsec from our FIRBACK optical ID. FN2 - 018: Identification with an optical galaxy (Pran = 0.037, r’ magnitude = 19.5, z_{phot} = 0.15, SO/a). However, the 175 μm flux has been assigned in the ELAIS catalogue to a source (ELAISC15_J163334.1+410139) with a different galaxy ID with Pran = 0.998 (r magnitude = 20.5), it is therefore not a possible ID. This also has an IRAS detection at 60 μm. There is another ELAIS source (ELAISR163333+410112) within the FIRBACK error ellipse whose galaxy ID has a Pran = 1.000

18 E. L. Taylor et al.

FN2 - 019: Identification with an optical galaxy (Pran = 0.001, r’ magnitude = 18.1, z_{phot} = 0.10, Sb). The ELAIS source (ELAISR163716+404825) to which the 175 μm flux has been assigned does not have an optical ID, it has detected emission at 6.7μm and 20 cm. This also has an IRAS detection at 60 μm.

FN2 - 020: Identification with an optical galaxy (Pran = 0.086, r’ magnitude = 20.2, z_{phot} = 0.15). The ELAIS source (ELAISC15_J163242.7+410627) to which the 175 μm flux has been assigned is fainter (r magnitude = 22.1) and further from the source than our ID and therefore has a higher Pran value of 0.990.

FN2 - 021: Identification with an optical galaxy (Pran = 0.001, r’ magnitude = 17.6, z_{phot} = 0.10). However, the flux of this FIRBACK source is below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

FN2 - 022: Identification with an optical galaxy (Pran = 0.019, r’ magnitude = 19.1). The ELAIS source (ELAISC15_J163708.1+412856) to which the 175 μm flux has been assigned has an optical identification with a bright optical galaxy with r’ magnitude = 18.8, it has Pran = 0.140 and is therefore a possible identification for the FIRBACK source. This ELAIS source has zspec = 0.17, is an Sa and detected emission at 15, 6.7 μm and radio emission at 20 cm. There is another ELAIS source (ELAISC7_J163709+412832) within the FIRBACK error elipse, however, its optical ID is stellar and therefore it has Pran = 1.0.

FN2 - 023: Identification with an optical galaxy (Pran = 0.018, r’ magnitude = 19.0, z_{phot} = 0.02, Sb/c). However, the flux of this FIRBACK source is below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

FN2 - 024: This source does not have a confident optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

FN2 - 025: Identification with an optical galaxy (Pran = 0.119, r’ magnitude = 20.2, z_{phot} = 0.20, Sa).The ELAIS source (ELAISC7_J163628+404757) to which the 175 μm flux has been assigned has optical ID classed as a galaxy, however, it looks stellar and has a Pran of 0.974 so is not a possible ID. There is another ELAIS source (ELAISC7_J163633+404749) within the FIRBACK error elipse, however, its optical ID is stellar and therefore it has Pran = 1.0. This also has IRAS detections at 60 and 100 μm. FN2 - 026: This source does not have a confident optical ID. It is associated with a galaxy with r’ magnitude 22.4 with a Pran = 0.906. There is an ELAIS source (ELAISC15_J163615.7+404759) within the FIRBACK error ellipse, however, it has a stellar optical ID and therefore has Pran = 1.0.

CFN2 - 027: This source does not have a confident optical ID. It is associated with a galaxy with r’ magnitude 20.7 with a Pran = 0.305. This does not agree with the ELAIS source (ELAISR163703+412425) optical ID which is a galaxy with Pran = 0.999.

CFN2 - 028: This source does not have a confident optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 029: Identification with an optical galaxy (Pran = 0.070, r’ magnitude = 19.6, z_{phot} = 0.15). The 175 μm flux has been assigned to a fainter galaxy (ELAISR163418+410729, r’ magnitude = 22.2) which is further from the FIRBACK position than our ID, it therefore has a high Pran of 1.0. This also has an IRAS detection at 60 μm. There are three other ELAIS sources (ELAISR163419+410641, ELAISC15_J163421.4+410622,

ELAISR163422+410648) within the FIRBACK error ellipse,

however, none of them have optical IDs.

CFN2 - 030: Identification with an optical galaxy (Pran = 0.086, r’ magnitude = 20.3, z_{phot} = 0.15, S0/a). However, the flux of this FIRBACK source is below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue. However, it has IRAS detections at 60 and 100 μm. CFN2 - 031: This source does not have a confident optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 032: This source does not have a confident optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 033: This source does not have a confident optical ID. It is associated with a galaxy with r’ magnitude 21.8 with a Pran = 0.934.

CFN2 - 034: Identification with an optical galaxy (Pran = 0.030, r’ magnitude = 19.4, z_{phot} = 0.55, S0/a). However, the flux of this FIRBACK source is below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 035: This source does not have a confident optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 036: Identification with an optical galaxy (Pran = 0.119, r’ magnitude = 19.4, z_{phot} = 0.10, Sa). However, the flux of this FIRBACK source is below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue. However, it has IRAS detections at 60 and 100 μm.

CFN2 - 037: This source does not have a confident optical ID. It is associated with a galaxy with r’ magnitude 22.1 with a Pran = 0.812. When associations are allowed with all objects this source is identified as a star with Pran = 0.183. However, this still does not agree with the stellar optical ID of the ELAIS source (ELAISR163812+405452) assigned the 175 μm flux.

CFN2 - 038: Identification with an optical galaxy (Pran = 0.023, r’ magnitude = 19.3, zspec = 0.14, Sb/c). This is also the optical ID for an ELAIS source (ELAISC15_J163431.5+412246) with detected emission at 15 μm and has an IRAS detection at 100 μm.

Properties of FIRBACK-ELAIS 175μm sources in the ELAIS N2 region 19

CFN2 - 039: Identification with an optical galaxy (Pran = 0.001, r’ magnitude = 17.2, zspec = 0.07, Sb). This is also the optical ID for an ELAIS source (ELAISC15_J163613.6+404230) with detected emission at 15, 6.7, 90 μm and radio emission at 20 cm. This also has an IRAS detection at 60 μm.

CFN2 - 040: This source does not have a confident optical ID. It is best associated with a galaxy with r’ magnitude 20.5 and Pran = 0.192. The ELAIS source (ELAISC15_J163641.1+413131) to which the 175 μm flux has been assigned has a galaxy optical identification with Pran = 0.562. There is another ELAIS source (ELAISC15_J163648.1+413134) within the FIRBACK error ellipse with a galaxy optical ID with Pran = 0.393.

CFN2 - 041: This source does not have a confident optical ID, however, its best association agrees with the optical identification of the ELAIS source (ELAISC15_J163433.6+405953) to which the 175 μm flux has been assigned. This galaxy has r’ magnitude = 19.2 and Pran = 0.311, the ELAIS source has detected emission at 15 μm and 20 cm. There are two other ELAIS sources (ELAISR163427+405936T,

ELAISC15_J163430.1+410055) within the FIRBACK error

ellipse, one has a galaxy optical ID with Pran = 0.998 and the other does not have an optical identification.

CFN2 - 042: This source does not have a confident galaxy optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 043: This source does not have a confident optical identification when associations are only allowed with galaxies (Pran = 0.437). However, when all objects are possible associations it is matched with a star (Pran = 0.056) which is also the ELAIS source (ELAISC7_J163546+404929) ID to which the 175 μm flux has been assigned. This ELAIS source has detected emission at 6.7 μm.

CFN2 - 044: Identification with an optical galaxy (Pran = 0.053, r’ magnitude = 20.0, z_{phot} = 0.05, S0/a). The ELAIS source (ELAISC15_J163730.4+404542) to which the 175 μm flux has been assigned has a galaxy ID with a Pran value of 0.995. This also has an IRAS detection at 60 μm. There is another ELAIS source (ELAISR163728+404533) within the FIRBACK error ellipse, however, this source does not have an optical ID.

CFN2 - 045: This source does not have a confident galaxy optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 046: This source does not have a confident optical association. The flux of this FIRBACK source is also below the ELAIS catalogue 5σ limit of 223 mJy and therefore as it has no associations at other ELAIS wavelengths it is omitted from the catalogue.

CFN2 - 047: Identification with an optical galaxy (Pran = 0.070, r’ magnitude = 19.0). The 175 μm flux has been assigned to an ELAIS source (ELAISC15_J163449.5+412048) with a galaxy optical ID with Pran = 0.125 which is therefore a possible association. This source has zspec = 0.25, is an S0/a and detections at 15, 6.7 μm and 20 cm. There is another ELAIS source (ELAISC15_J163451.9+411944) within the FIRBACK error ellipse with a galaxy optical ID with Pran = 0.911.

CFN2 - 048: This source does not have a confident optical identification, is is best associated with a galaxy with Pran = 0.920. The ELAIS source (ELAISC15_J163739.2+405643) to which the 175 μm flux has been assigned does not have an optical identification.

CFN2 - 049: Identification with an optical galaxy (Pran = 0.092, r’ magnitude = 20.3, z_{phot} = 0.18). An ELAIS source (ELAISC15_J163741.3+411913) ID has an optical ID with the same galaxy, however, they are different entries in the INT catalogue caused by the splitting up of bright objects by the image analyser. The ELAIS source has detected emission at 15 and 90 μm and is possible an Sa. This also has an IRAS detection at 60 μm. There is another ELAIS source (ELAISC15_J163738.9+411840) within the FIRBACK error ellipse with a galaxy optical ID with Pran = 0.911.

CFN2 - 050: This source falls between two WFS chips. CFN2 - 051: This source does not have a confident optical identification, it is best associated with a galaxy with Pran = 0.866. The ELAIS source (ELAISC15_J163616.2+411426) to which the 175 μm flux has been assigned has a stellar optical ID and therefore is not a possible ID for the FIRBACK source.

CFN2 - 052: This source does not have a confident optical identification, it is best associated with a galaxy with Pran = 0.466. The ELAIS source (ELAISC15_J163403.0+410350) to which the 175 μm flux has been assigned has a galaxy optical ID with Pran = 0.962. There are two other ELAIS sources (ELAISC7_J163407+410219, ELAISR163410+410326) within the FIRBACK error ellipse one with a stellar ID and one with a galaxy ID, however, both have Pran = 1.0.

CFN2 - 053: This source does not have a confident optical identification, it is best associated with a galaxy with Pran = 0.441. The ELAIS source (ELAISR163621+412244) to which the 175 μm flux has been assigned has a galaxy optical ID with Pran = 0.989.

CFN2 - 054: This source does not have a confident optical identification. When associated with all optical objects it is confidently associated with a star with Pran = 0.215, the ELAIS source (ELAISC7_J163658+411417) assigned the 175 μm flux also has a stellar ID with Pran = 0.350 which is below the limit of 0.4 and therefore a possible association.