arXiv:astro-ph/0503297v2 2 May 2005

Astronomy & Astrophysics manuscript no. eindi˙rev2 August 9, 2017 (DOI: will be inserted by hand later)

Letter to the Editor

The cool atmospheres of the binary brown dwarf ε Indi B^⋆

M. F. Sterzik^1, E. Pantin^{1,2}, M. Hartung^1, N. Huelamo^1, H.U. Käufl^3, A. Kaufer^1, C. Melo^1, D. Nürnberger^1 , R. Siebenmorgen^3 , A. Smette^1

1 European Southern Observatory, Casilla 19001, Santiago 19, Chile 2 DSM/DAPNIA/Service d’Astrophysique, CEA/Saclay, F-91191 Gif-sur-Yvette, France 3 European Southern Observatory, D-85748 Garching b. München, Germany

Received ; accepted

Abstract. We have imaged ε Indi B, the closest brown dwarf binary known, with VISIR at the VLT in three narrow-band mid-infrared bandpasses located around 8.6μm, 10.5μm and 11.3μm. We are able to spatially resolve both components, and determine accurate mid-infrared photometry for both components independently. In particular, our VISIR observations probe the NH_3 feature in the atmospheres of the cooler and warmer brown dwarfs. For the first time, we can disentangle the contributions of the two components, and find that ε IndiBb is in good agreement with recent “cloud-free” atmosphere models having an effective temperature of T_{eff} = 800 K. With an assumed age of 1 Gyr for the ε Indi system, component Ba agrees more with T_{eff} ≈ 1100 K rather than with T_{eff} = 1200 K, as suggested by SPITZER spectroscopic observations of the combined ε Indi B system (Roellig et al., 2004). Even higher effective temperatures appear inconsistent with our absolute photometry, as they would imply an unphysical small size of the brown dwarf ε IndiBa.

Key words. stars: low-mass, brown dwarfs — stars: binaries: general

1. Introduction

ε Indi B, the closest brown dwarf known (Scholz et al., 2003), has been recently discovered as a close binary, consisting of two brown dwarf components separated by 0.73^{′′}(McCaughrean et al., 2004). The system has a wellestablished distance (3.626 pc, ESA 1997) and age (range 0.8- 2Gyr; Lachaume et al., 1999), and will allow the determination of fundamental physical parameters like its mass, luminosity, effective temperature, and surface gravity with unprecedented precision. Extending the analysis towards the midinfrared (MIR) offers the opportunity to benchmark evolutionary and atmospheric models for very low temperatures. Adaptive optics assisted near-infrared (H-band) low-resolution (R ∼ 1000) spectroscopy (McCaughrean et al., 2004) of both components individually lead to a most likely spectral classification of T1 for ε Indi Ba and T6 for ε Indi Bb based on the Burgasser et al. (2002) H_2O and CH_4 spectral indices. Effective temperatures between 1238K and 1312K were derived for ε Indi Ba and between 835K and 875K for ε Indi Bb, bracketed by assuming the most likely ages between 0.8 and 2 Gyrs. However, the comparison of high-resolution (R ∼ 50000) near-

Send offprint requests to: M.F. Sterzik, e-mail: msterzik@eso.org ⋆ Based on observations collected with the ESO VLT, Paranal, Chile, program 60.A-9245(A).

infrared spectra of ε Indi Ba (Smith et al., 2003) with synthetic atmosphere spectra of Tsuji (2002) leads to a much higher T_{eff} = 1500 ± 100 K. The reasons for the large discrepancy are not known, but may be related to the radius of the brown dwarf or to uncertainties in the bolometric corrections assumed. ε Indi B has recently been observed by the SPITZER Space Telescope in the mid-infrared (Roellig et al., 2004). Their lowresolution IRS spectrum is a composite spectrum of both components, as the limited angular resolution of SPITZER does not allow to resolve it spatially. Roellig et al. claim that their observation is the first evidence for NH_3 absorption in very cool brown dwarf atmospheres between 10μm and 11μm, although they cannot disentangle the contributions of both components individually. The SPITZER spectrum matches well a composite model described by Saumon, Marley & Lodders (2003, hereafter SML), assuming cloudless synthetic spectra. Here, we report spatially resolved MIR photometry of ε Indi B obtained with VISIR, the new mid-infrared camera and spectrometer at the VLT (Lagage et al., 2004) during science verification. Our goal is to constrain the most pertinent brown dwarf model atmospheres with our data.

2 Michael F. Sterzik et al.: The cool atmospheres of ε Indi B

2. Observations

ε Indi B has been imaged with VISIR mounted on the UT3 (Melipal) of the VLT on Sept. 28, 2004 (in filters PAH1 and PAH2) and on Sept. 30, 2004 (in filter Siv) under clear and stable atmospheric conditions. A nominal pixel scale of 0.075^{′′}was used in all bands, and standard chopping and nodding techniques (10^{′′}amplitudes) were employed. Fig. 1 show the final, co-added and median cleaned images that were used for sub-sequent photometry. The binary is clearly resolved, the measured image quality (FWHM) on the final frames is around 0.4 − 0.5^{′′} for each point source, slightly above the diffraction limit. While the position angle from our three measurements (137^∘ ± 6^∘) is consistent with that determined by McCaughrean et al. (2004) using AO one year earlier (136.81^∘ ± 0.14^∘), our separation (0.92^{′′} ± 0.06^{′′}) is larger (0.732^{′′} ± 0.002^{′′}), and suggests orbital motion.

A summary of the observing log, filter central wavelengths, half band-width and total on-source integration times, is given in Table 1. Source count-rates were determined with standard aperture photometry. Curve-of-growth methods were applied to find the aperture radii that maximized the signal-to-noise ratio of the extracted source. Those radii were then also used for the calibration source to determine the count-rate to flux conversion factor. For faint sources, the optimal extraction aperture radius is not always well determined, and the presence of a second companion does not allow to grow the aperture to more then half of their distance. The variation of the count-rate to flux conversion factors with aperture radius was screened for aperture radii of 4, 5 and 6 pixel (corresponding to radii of 0.3^{′′}, 0.375^{′′}, 0.45^{′′}), and constitutes the main error in the absolute flux calibration of the targets. Different calibrator stars^1 observed at different airmasses give fully consistent results, and their contribution to the absolute photometric errors is negligible. Flux ratios between the components, and between different filter passbands can be obtained with a much higher accuracy, as the errors are only related the spread of the count rates in the four different beams, and rather independent on the actual choice of the aperture radius. Fluxes and ratios together with error estimates are summarized in Table 2.

We note that the combined fluxes of components Ba and Bb agree with the spectrophotometric fluxes for the ε Indi B system deduced from the SPITZER spectrum shown in Fig.2 of Roellig et al. (2004), albeit our fluxes are on the low side of their allowed 25% error range in absolute flux calibration. Component Ba dominates the mid-infrared emission, and component Bb contributes about 1/3 to the total flux density. Our Siv filter located at a central wavelength of 10.5μm is particular well suited to probe the potential presence of NH_3 absorption features in brown dwarf atmospheres. In fact, a significant change of the relative spectral shape between both components becomes evident in the reddest passband around 11.3μm (PAH2), where the flux of Bb comes close to that of Ba. The flux ratio Siv/PAH2 is small for component Bb, indicating the presence of a strong NH_3 absorption band. We find no indication for strong absorption in component Ba, though.

1 taken from the list of Cohen et al. (1999)

Table 1. Log of the VISIR observations of ε Indi B.

RJD Filter λ_{cen} Δλ AM Int[s] Calibrator^a

53277.6 PAH1 8.59 0.42 1.18 3638 HD224630 HD10550 53277.7 PAH2 11.25 0.59 1.29 3587 HD224630 53279.6 Siv 10.49 0.16 1.18 3564 HD178345

Table 2. Mid-infrared flux densities and flux ratios of ε Indi B.

Object PAH1 Siv PAH2^{Siv}_{PAH1}^{Siv}_{PAH2} [mJy] [mJy] [mJy]

Ba 7.4 ± .4 7.2 ± .6 6.8 ± .8 .97 ± .02 1.06 ± .03 Bb 3.5 ± .4 3.5 ± .8 5.7 ± 1. 1.0 ± .04 0.61 ± .08

3. Comparison with Atmosphere Models

Atmosphere models are typically calculated on a grid of T_{eff}/g pairs, for specific metallicities. Taylor (2003) lists [Fe/H]=0.056±0.038 for ε Indi A; therefore we refer to solar metallicities also for ε Indi B.

The object radius R is the main parameter that determines the absolute spectral flux calibration of the model atmospheres, and is obtained from evolutionary calculations. Comparing the evolutionary models of Baraffe et al. (2003) with those of Burrows et al. (1997) (in the given grid of ages and temperatures), we find that their radii agree within 2%. In the following we refer to the Burrows models, only, and note that different models do not contribute significantly to uncertainties in the absolute model fluxes. In Table 3 we summarize the (sub- )stellar parameters log g, L_{bol} and R assuming an age of 1Gyr for the ε Indi B system. We note, however, that the age range allowed for ε Indi implies systematic variations of the model radius. While the younger age (0.8Gyr) increases the radius by about 3%, the older age (2Gyr) decreases the radius by 7% for all temperatures considered here. Systematic uncertainties up to 15% are therefore implicit in the absolute normalization of the model fluxes due to the age uncertainty of ε Indi. Burrows, Sudarsy & Lunine (2003) explore the age and mass dependance of H_2O, CH_4 and NH_3 molecular bands on MIR spectra of very cool brown dwarfs with T_{eff} ≤ 800 K. We have selected a suitable spectral model (T_{eff} = 800 K, log g = 5) which represents a brown dwarf with a mass of M = 25M_{jup} and an age of 1Gyr^2. For the hotter component, the cloud-free model spectrum for an age of 1Gyr corresponding to M = 46M_{jup} and M = 41M_{jup} for T_{eff} =1200K and T_{eff} = 1100 K, respectively, were supplied by A. Burrows (pers. comm.). Also Allard et al. (2001) provide model atmosphere spectra in the assumed parameter range. We concentrate our comparison to their “cloudless” models, which include the effects of condensation in chemical equilibrium, but ignore the effects of dust opacities altogether. Their model spectra are freely downloadable from the web^3. Finally, also SML provide MIR spectra of brown dwarfs. In fact, their cloudless synthetic spectra for

2 zenith.as.arizona.edu/∼burrows/bsl/bsl.html 3 ftp.ens-lyon.fr/pub/users/CRAL/fallard/AMES-Cond-2002

Michael F. Sterzik et al.: The cool atmospheres of ε Indi B 3

Fig. 1. VISIR images of ε Indi B in three filters PAH1, Siv and PAH2. Components a+b are clearly resolved in all three bandpasses. North is up, and east left: ε Indi Bb is the fainter source to the south-east.

T_{eff}=1200K and T_{eff}=800K (log g = 5) were combined and compared to the SPITZER spectrum in Roellig et al. (2004). Both spectra were provided to us by D. Saumon directly. For all model spectra we calculated the expected flux densities in the corresponding VISIR filter passbands by convolving the model spectrum with the respective filter transmission profiles^4. In Table 4 we summarize and compare the predicted model flux densities for the different model atmospheres. In boldface we mark those values that are consistent with our VISIR measurements (Table 2) allowing for a 3σ error range. From the comparison in Table 4 we infer that most of the available model spectra for the cooler component Bb are consistent with the absolute MIR photometry. They also essentially match the flux ratios (which are independent of absolute calibration issues like the radius assumed), but tend to underestimate the^{Siv}_{PAH1} color. All models predict a clear signature of a more or less pronounced NH_3 absorption feature, which is also present in our data. The predicted absolute fluxes appear somewhat (≈ 20%) higher than the measured ones, but are still within the allowed error range.

The warmer component Ba is more difficult to reconcile with current models and assumptions about the ε Indi B system. While cloud-free models, assuming an age of 1Gyr and an effective temperature of 1200K for Ba as used by Roellig et al. (2004) agree very well with their SST/IRS spectrum, they appear only marginally consistent with our VISIR mid-infrared photometry. The spectral shape measured for Ba (decreasing flux with increasing wavelength) is not reflected in these models. Also, their predicted MIR fluxes are ≈ 30% − 100% higher then measured in the corresponding VISIR passbands. Assuming an age of 2Gyr – at the high limit of the allowed age range – reduces the model radius to R = 0.087R_⊙, and the predicted MIR fluxes by 13%. This is not sufficient to explain the lower flux densities observed. An age of 5Gyr with a radius of R = 0.082R_⊙ would be required in order to match the absolute fluxes. One straightforward way to reduce the ab-

4 http://www.eso.org/instruments/visir/inst/ sorption signatures of NH_3 is to increase the temperature of the atmosphere. In fact Allard’s et al. AMES-cond model for T_{eff} = 1500 K can be considered to be fully consistent with our relative photometry. However, when we apply the evolutionary models of Burrows et al. (1997) with a radius of R = 0.09R_⊙, the absolute photometry is grossly off. T_{eff} = 1500 K for component Ba has also been favored by Smith et al. (2003) based on the analysis of high-resolution near-infrared spectroscopy. This temperature together with the published luminosity of component Ba (log L_{bol} = −4.71, McCaughrean et al. 2004), however, leads to a radius of only R = 0.062R_⊙ (Smith et al., 2003). With this smaller radius, the absolute VISIR photometry can now be made consistent with the spectral model. But this radius is in contradiction to all known evolutionary models (see also McCaughrean et al., 2004). Moreover, it also seems empirically unlikely in view of recent measurements of the massradius relation for very-low mass stars and giant planets, which prove to be similar (Pont et al., 2005). But more, direct, determinations of radii in the brown dwarf mass regime are necessary to completely rule out this possibility. As can be inferred from Table 4, both available atmosphere models with T_{eff} = 1100 K tend to agree better with our measurements, assuming brown dwarf radii derived from evolutionary models at 1Gyr. The Burrows et al. models (shown in Figure 2 together with our photometry) for Ba seem to produce a slightly better match for the PAH2 measurement because of the presence of a strong absorption feature (that is less pronounced in the AMES-cond atmosphere).

4. Summary

We report the detection of both components of ε Indi B, the closest brown dwarf binary known, with VISIR at the VLT in three narrow-band mid-infrared bandpasses located around 8.6μm, 10.5μm and 11.3μm. We are able to determine accurate mid-infrared absolute photometry for both components independently, with an error level of 5-10% for the brighter component Ba, and 10-20% for the fainter Bb. Relative photom-

4 Michael F. Sterzik et al.: The cool atmospheres of ε Indi B

Table 3. Brown dwarf structural parameters according to evolutionary calculations of Burrows et al. (1997) for 1Gyr.

Object SpT^a T_{eff} log g log L_{bol} M R [K] [cm s^{−2}] [L_⊙] [M_{jup}] [R_⊙]

Ba T1 1200^b 5.1 -4.78 46 0.093 1500^c 5.3 -4.42 59 0.090^d 1100 5.1 -4.92 41 0.095 Bb T6 800^b 4.8 -5.42 25 0.102

a Spectral types according to McCaughrean et al. (2003) b T_{eff} assumed by Roellig et al. (2004) c T_{eff} according to Smith et al. (2003) d Smith et al. (2003) assume R/R_⊙=0.062 and L/L_⊙=-4.71

Table 4. MIR flux densities for various model atmospheres. Values printed in boldface are consistent with our observations within 3σ. The 800K models refer to ε Indi Bb, while the warmer models to Ba.

Reference T_{eff} PAH1 Siv PAH2^{Siv}_{PAH1}^{Siv}_{PAH2} [K] [mJy] [mJy] [mJy]

Allard^a 800 4.32 3.64 6.98 0.84 0.52 Burrows^b 800 4.76 4.10 6.04 0.86 0.68 Saumon^c 800 3.68 2.18 4.86 0.59 0.45 Allard^a 1100 8.83 8.93 12.04 1.01 0.74 Burrows^d 1100 7.96 8.79 8.83 1.10 1.00 Allard^a 1200 10.67 11.36 13.21 1.06 0.86 Burrows^d 1200 9.13 10.36 9.99 1.13 1.04 Saumon^c 1200 9.21 9.87 11.68 1.07 0.85 Allard^a 1500 17.09 16.97 16.60 0.99 1.02 Allard^e 1500 8.11 8.05 7.88 0.99 1.02

a AMES-cond models from Allard et al. (2001) b cloud-free model from Burrows, Sudarsky & Lunine (2003) c cloud-free models from Saumon, Marley & Lodders (2003, private communication) d cloud-free model from Burrows (private communication) e assuming R/R_⊙ = 0.062

etry and flux ratios can be measured with even higher accuracy. Our data show that component Bb has a prominent absorption feature around 10.5μm, most likely explained by NH_3. We then compare our MIR photometry with atmospheric model spectra, using the well-known distance, metallicity and age of the ε Indi B system as main input parameters. The MIR emission of the cool component Bb appears to be fully consistent with current atmosphere models assuming an effective temperature of T_{eff} = 800 K. The warmer component Ba appears only marginally consistent with T_{eff} = 1200 K, a temperature that has been inferred from SPITZER spectroscopic observations of the combined ε Indi B system (Roellig et al., 2004), and from near-infrared photometry (McCaughrean et al. 2004), if we assume a canonical age of 1Gyr for the ε Indi B system. We instead favor a slightly lower effective temperature of T_{eff} = 1100 K to reconcile the absolute MIR fluxes and the spectral shape, which does not show any evidence for NH_3

Fig. 2. Comparison of the VISIR photometry with various atmosphere spectra from BSL and Burrows (private communication). Radii assumed are consistent with evolutionary tracks of Burrows et al. (1997).

absorption. A higher effective temperature of T_{eff} = 1500 K which would agree with the spectroscopic temperature derived for the ε Indi B system by Smith et al. (2003), implies a nonphysical small radius of ε Indi Ba, and is therefore unlikely.

Acknowledgements. We like to thank the VISIR science verification team and the ESO director general for allocating observing time to this project. We appreciate to use the model spectra of F. Allard, A. Burrows and D. Saumon in electronic form. A. Burrows to supplied his 1100K and 1200K spectrum, and D. Saumon his 800K and 1200K model directly. The referee, A. Burgasser, helped to improve the paper.

References

Allard, F., Hauschildt, P.H., Alexander, D.R., Tamanai, A., & Schweitzer, A., 2001, ApJ556, 357 Baraffe, I., Chabrier, G., Barman, T. S., Allard, F., Hauschildt, & P. H., 2003, A&A402, 701 Burgasser, A.J., Kirkpatrick, D.J., Brown, M.E., et al., 2002, ApJ, 564, 421 Burrows, A., Marley, M., Hubbard, W.B., et al., 1997, ApJ, 491, 856 Burrows, A., Sudarsky, D., & Lunine, J.I., 2003, ApJ, 596, 587 Cohen, M., Walker, R.G., Carter, B., Hammersley, P., Kidger, M., & Noguchi, K., 1999, AJ, 117, 1864 Creech-Eakman, M.J., Orton, G.S., Serabyn, E., & Hatward, T.L., 2004, ApJ, 602, L129 ESA 1997, Hipparcos and Tycho catalogues, ESA-SP 1200 Lagage, P.O., Pel, J.W., Claret, A., et al., 2003, SPIE, 4841, 923 Lauchaume, R., Dominik, C., Lanz, T., & Habing, H.J., 1999, A&A, 348, 897 McCaughrean, M.J., Close, L.M., Scholz, R.-D. et al., 2004, A&A, 413, 1029 Pont, F., Melo, C.H.F., Bouchy, F., Udry, S., Queloz, D., Mayor, M, & Santos, N.C., 2005, A&A, 433, L21 Roellig, T.L., van Cleve, J.E., Sloan, G.C., et al., 2004 ApJS, 154, 418 Scholz, R.-D., McCaughrean, M.J., Lodieu, N., & Kuhlbrodt, B., 2003, A&A, 389, L29

Michael F. Sterzik et al.: The cool atmospheres of ε Indi B 5

Saumon, D., Marley, M.S., & Lodders, K., 2003, arXiv:astro-ph/0310805 (SML) Smith, V., Tsuji, T., Hinkle, K.H., et al., 2003, ApJ, 599, L107 Taylor, B.J., 2003, A&A398, 73 Tsuji, T., 2002, ApJ, 575, 264