arXiv:astro-ph/0409012v1 1 Sep 2004

The Serendipitous Extragalactic X-Ray Source Identification (SEXSI) Program: II. Optical Imaging

Megan E. Eckart^1, Elise S. Laird^{2,3}, Daniel Stern^4, Peter H. Mao^{1,5}, David J. Helfand^2, & Fiona A. Harrison^1

ABSTRACT

The Serendipitous Extragalactic X-ray Source Identification (SEXSI) Program is designed to expand significantly the sample of identified extragalactic hard X-ray sources at intermediate fluxes, 10^{−13} erg cm^{−2} s^{−1} ∼< S_{2−10 keV} < 10^{−15} erg cm^{−2} s^{−1}. SEXSI, which includes sources derived from more than 2 deg^2 of Chandra images, provides the largest hard X-ray-selected sample yet studied, offering an essential complement to the Chandra Deep Fields (total area ∼ 0.2 deg^2). In this paper we describe R-band optical imaging of the SEXSI fields from the Palomar, MDM, and Keck observatories. We have identified counterparts, or derived flux limits for nearly 1000 hard X-ray sources. Using the optical images, we derive accurate source positions. We investigate correlations between optical and X-ray flux, and optical flux and X-ray hardness ratio. We also study the density of optical sources surrounding X-ray counterparts, as well as the properties of optically-faint, hard X-ray sources.

Subject headings: catalogs — surveys — X-rays: galaxies — X-rays: general — galaxies: active

1. Introduction

With the successful launch in 1999 of the Chandra X-Ray Observatory (Weisskopf et al. 1996) came the opportunity to explore the X-ray universe with greater angular resolution

1Space Radiation Laboratory, 220-47, California Institute of Technology, Pasadena, CA 91125

2Columbia University, Department of Astronomy, 550 West 120th Street, New York, NY 10027

3Astrophysics Group, Imperial College London, Blackett Laboratory, Prince Consort Road, London SW7 2BW, UK

4Jet Propulsion Laboratory, California Institute of Technology, Mail Stop 169-506, Pasadena, CA 91109

5University of California at Los Angeles, Department of Earth and Space Sciences, 595 Charles Young Dr. East, Los Angeles, CA 90095

– 2 –

and sensitivity in the 2 – 10 keV energy range than ever before. One of the primary goals of the mission is to perform surveys of the extragalactic sky at these higher energies.

The longest Chandra pointings thus far are the Chandra Deep Field - North (Alexander et al. 2003) and -South (Giacconi et al. 2002), with 2 Ms and 1 Ms exposure times, respectively. These fields have explored faint sources, with many objects reaching below the luminosity range of active galactic nuclei (AGN) to include “normal” galaxies. Though the Deep Fields are pushing to lower fluxes than previously attainable, they cover only a small area (∼ 0.1 deg^2 each), and do not have good statistics for the flux range in which the dominant contribution to the 2 – 10 keV X-ray background arises. To get such statistics, a larger area of the sky must be covered by combining multiple Chandra pointings.

The Chandra archive provides the opportunity to explore multiple, mid-depth (∼ 50 − 100 ks) exposures. In Harrison et al. (2003, Paper I) we presented the Serendipitous Extragalactic X-ray Source Identification (SEXSI) program design, our X-ray analysis techniques and a catalog of over one thousand 2 – 10 keV sources, as well as some initial X-ray results and comparisons with previous work. With data from 27 archival Chandra fields, SEXSI is designed to focus on a large-area (∼ 2 deg^2) sample of X-ray sources in the intermediate flux range (∼ 10^{−13} −10^{−15} erg cm^{−2} s^{−1}). Our goal is to determine spectroscopically the redshift distributions and nature of hard (2 – 10 keV) X-ray source populations from which the bulk of the X-ray background arises. The campaign of single-color photometry presented here attempts a minimum depth for every field of R ∼ 22 − 23, consistent with identifying counterparts for which classifiable spectra can be obtained with a 10-m telescope in a ∼ 1 hour integration. This strategy maximizes the number of hard sources identified spectroscopically in our fields for our fixed observing campaign.

Other programs are also aiming to understand the X-ray source population at medium depth with degree-scale Chandra and XMM-Newton surveys. Examples of such surveys include HELLAS2XMM (e.g., Baldi et al. 2002; Brusa et al. 2003) and the Chandra Multiwavelength Project (ChaMP; e.g., Kim et al. 2003; Green et al. 2004). Brandt et al. (2004) presents a comprehensive list of the many ongoing X-ray background surveys.

The SEXSI program is unique among the Chandra Serendipitous surveys in concentrating on obtaining a uniform spectroscopic survey restricted to the hard source population. The ChaMP, in contrast, is a comprehensive program of imaging and spectroscopy to followup both soft and hard sources in a large number of publicly-accessible extragalactic Chandra pointings. The SEXSI spectroscopic catalog will therefore contain a larger fraction of obscured AGN than ChaMP. Eight of the fields are common to both surveys, and for one of these ChaMP has published some spectroscopic followup (Green et al. 2004). Even for the common fields, SEXSI plans deeper spectroscopy and should identify a greater number

– 3 –

of hard X-ray sources. Between the large number of distinct fields and the different focus for ground-based followup, the SEXSI survey provides an essential complement to current surveys of the sources responsible for the X-ray background.

In this paper, we present optical R-band imaging of the SEXSI Chandra fields, as well as the methodology used to derive X-ray source identifications and a catalog of Rband counterpart magnitudes. In addition, we explore relationships between the X-ray flux, hardness ratio, and R-band magnitude. A third paper in this series (Eckart et al., in preparation; Paper III) will include our optical spectroscopic results, with redshifts and classifications for ∼ 450 of these objects, and a discussion of the luminosity distribution, redshift distribution, and composition of the sample.

2. Optical Imaging and Reduction

We have imaged the SEXSI fields using the Palomar 60-inch (P60) and 200-inch (P200) telescopes, the MDM 2.4-meter (MDM-2.4) and 1.3-meter (MDM-1.3) telescopes, and the Keck I telescope. Much of the early optical imaging for this program was done with small field-of-view, single-CCD array cameras. For example, the P60 CCD13 camera has a 12.6^′×12.6^′ field of view. This requires several pointings to map a typical 17^′ × 17^′ Chandra field, making multi-color imaging very time consuming. Since Spring 2000, both the P200 and MDM-2.4 have had large-format (∼> 24^′ × 24^′) CCD cameras available, allowing us to cover nearly all of a Chandra field in a single pointing. The P200 Large Format Camera (LFC; Simcoe et al. 2000) uses the Sloan digital sky survey (SDSS) filter set (g^′, r^′, i^′, and z^′; Fukugita et al. 1996), while, for our MDM-2.4 8K camera (Crotts 2001) imaging, we used Johnson-Cousins filters (B, V , R, and I). In each filter band, our goal has been to obtain images with a limiting Vega magnitude of ∼ 24, the practical limit for obtaining counterpart spectra at the Keck telescope in reasonable integration times. Because the largeformat cameras were not available for the first 1.5 years of the SEXSI project, some fields are imaged only in R band (due to observing time constraints), while the fields observed later in the program generally have multicolor data. For the purposes of this paper, we use only the R-band data. Table 1 summarizes the characteristics of the telescopes and imaging instruments used in this program.

We reduced the optical images using standard techniques, relying upon IRAF tasks for the preliminary steps. Median-combined bias frames, taken the same night as the science data, were subtracted from the images. For flatfielding, we used either dome flats or sky flats generated by combining all the images from a night, including twilight flats, with min/max rejection to remove stars. We used standard techniques to mask out cosmic rays and bad

– 4 –

pixels prior to combining data.

For astrometric calibration of most of the data, we used the DOPHOT software package to locate all nonsaturated, point-like objects in individual exposures. Comparing with the USNO-A2.0 catalog (Monet 1998), we then used the object-matching program starmatch (by Doug Reynolds) to both align the images before stacking and to obtain an astrometric solution for the final, combined image. The standard deviations of the astrometric solutions are generally ≤ 0.3^{′′} in each axis.

We reduced images using the same methodology for both the LFC data from the P200 telescope and the 8K data from the MDM-2.4 telescope, although slightly different suites of software were required. We relied upon the MSCRED package within IRAF, designed for reduction of large-format, multi-array optical data from the Kitt Peak/Cerra Tololo MOSAIC cameras, following the informative reduction pipeline outlined by B. Jannuzi^1. For the LFC images this necessitated first changing the data into the requisite format using the LFCRED package created by M. Hunt^2.

2.1. Photometric calibration

We relied on a variety of methods to provide photometric calibration of the data, depending upon the conditions under which data for a SEXSI field were taken. Throughout, unless otherwise noted, we refer our magnitudes to the Vega-based system. If conditions were photometric, we determined magnitude zeropoints from Landolt (1992) fields observed the same night, at an airmass close to that of the field in question. In cases where a nonphotometric image overlaps a photometric image from another night, we determined the zeropoint magnitude by matching the photometry of overlapping regions.

In cases where we obtained no photometric images of a field, we relied on shallow sky surveys to provide magnitude zeropoints. Where available, we used r^′ photometry from the SDSS first data release (Abazajian et al. 2003), converting from AB magnitudes to Vega magnitudes with r^′(Vega) = r^′(AB) − 0.17. (1)

Alternatively, we used the USNO-B1.0 catalog (Monet et al. 2003) to establish the zeropoint. Typical photometric calibration errors for this technique were 0.2 mag.

1See http://www.noao.edu/noao/noaodeep/Reduction0pt/frames.html.

2See http://wopr.caltech.edu/∼mph/lfcred.

– 5 –

For the purposes of this paper, we make the assumption that the SDSS r^′ and Johnson- Cousins R filters are similar. Convolving the respective filter transmission curves with the Vanden Berk et al. (2001) composite SDSS quasar spectrum redshifted from z = 0 to z = 3, we find that this assumption provides a ∼< 0.1 mag systematic uncertainty in our photometry. Performing the same exercise on the Kinney et al. (1996) composite galaxy templates, we find systematic offsets ∼< 0.2 mag for z = 0, with larger systematic offsets at higher redshifts. For example, the S0 composite template at z = 1 has a 0.39 mag difference between the r^′ and R Vega magnitudes due to the 4000 Å break redshifting out of the r^′ filter. Though imprecise, our assumption that the r^′ and R filters are similar is adequate to establish the faint source limit of each image, and to plan spectroscopic observing runs.

2.2. Source extraction and limiting magnitudes

For extraction of sources from our combined, calibrated optical images, we used the SExtractor code of Bertin & Arnouts (1996) to generate catalogs for both the full optical images and for the smaller, central portions of each image. Because they avoid the CCD edges where the increased noise leads to spurious sources, these latter catalogs are used to derive photometric depths. Quoted magnitudes refer to the SExtractor MAGBEST, which usually reports photometry within elliptical apertures (Kron 1980), but reverts to a corrected isophotal magnitude if a source is strongly contaminated by nearby sources.

To determine limiting magnitudes for each image, we made histograms of the R-band source density in 0.5 magnitude bins. Figure 1 shows an example histogram from SEXSI field Q2345. For each SEXSI field image, we compare the measured number counts N to that derived by Capak et al. (2004) from deep Subaru imaging of the Hubble Deep Field-North:

N = B 10^{A∗(AB Magnitude)}, (2)

where N has units of number degree^{−2} 0.5 mag^{−1}. For R-band magnitudes in the range 20.0 − 25.0, Capak et al. (2004) finds A = 0.361 and log B = −4.36. Converting our R-band photometry into the AB system with Equation 1, we plot our measured number counts for each image with the published, deep-field fit (see Figure 1). In order to derive a crude depth for our images, we compare our number counts in each 0.5 mag bin to Equation 2 (at bin center). Limiting magnitudes are defined by the inter-bin flux where our number counts go from greater than 80% to less than 80% of the Capak et al. (2004) value: this provides an ∼ 80% completeness depth for each image. By the nature of our algorithm, then, these limits are good to ≈ 0.5 mag.

Table 2 summarizes the R-band optical imaging we have obtained for the SEXSI fields.

– 6 –

The average X-ray to optical offsets, ⟨Δα_{xo}⟩ and ⟨Δδ_{xo}⟩, are discussed in § 3 below. We derived R-band Galactic extinction for the central position of each X-ray image using the NED Galactic extinction calculator^3. Checking the variance of the NED extinction values across the Chandra field of view, we find that the typical error on the extinction is ≈ 0.02 mag. Three of our fields, however, have significantly higher extinctions than the other fields, and thus have an uncertainty of ±0.2 mag in their extinction values for individual sources. These fields are flagged in Table 2.

Approximately half of the SEXSI fields were observed with a single, uniform depth image; the other half rely on imaging from multiple cameras and telescopes over several observing runs. Of the fifteen fields with a single optical image, six reach R-band depths ≥ 24.0, and ten reach R-band depths ≥ 23.2. The shallowest field, CL 0442+0202, only reaches R = 21.1, while the deepest field, CL 0848+4454, reaches R = 24.4. Of the twelve fields with imaging from multiple pointings, eight have sections reaching depths of at least R = 23.0. A histogram of imaging depth for each source is shown in Figure 2.

3. Optical Counterparts to X-Ray Sources

We match X-ray and optical sources in several steps. The procedure is slightly different depending on whether there is one optical image or multiple optical images per Chandra field.

For fields with a single optical image, we first identify the closest optical source within 4^{′′} of each Chandra source position. Excluding sources displaced by more than 1.5σ from the mean offset, we use these identifications to calculate a first estimate of the average offset between the Chandra and USNO astrometry. For the following iterations, the search radius used to identify optical counterparts depends upon the off-axis angle (OAA) of the X-ray source: we use the larger of 1.5^{′′} and PSF/3, where PSF is the full-width, half-maximum of the Chandra point spread function at each OAA. Again, we exclude sources displaced by more than 1.5σ from the mean as we iteratively correct the X-ray source positions. We continue iterating until the corrections to the offsets are less than the corresponding standard deviation. Two to three iterations are typically required, with the biggest shift applied after the initial matching. As shown in Table 2, the typical standard deviation on this astrometric correction is ∼< 0.3^{′′}, comparable to the accuracy of the optical astrometry.

For fields with multiple optical images we modify this algorithm slightly. Some images

3See http://ned.ipac.caltech.edu/forms/calculator.html.

– 7 –

cover an area with few (or one) X-ray sources, which, if we were to follow the procedure described above, could lead to incorrect offsets and matches. Instead, for a given Chandra field, we first take each optical image and find the closest match within a 4^{′′} radius of all Chandra source positions that fall within the image. We record these astrometric differences. For X-ray sources falling on multiple optical images, we use the data from the image with the deepest limiting magnitude. As before, we use this list of multi-image astrometric differences to calculate an average Chandra to USNO offset, again eliminating sources greater than 1.5σ from the mean offset. This astrometric correction is then applied to all Chandra positions for the SEXSI field considered. A second pass at optical identifications is then made with the OAA-dependent matching radius, using the larger of 1.5^{′′} and PSF/3. Of the 998 SEXSI sources with optical coverage, 655 used a 1.5^{′′} search radius, while 343 used the PSF/3 search radius.

We expect few false matches due to an optical source randomly overlapping the matching search area. The number of false matches per field depends upon both the number of Xray sources detected in the Chandra field, and the depth of the optical image. We tested several fields from Table 2 for false matches by finding the total area covered by the 1.5^{′′} radius search circles and multiplying that area by the optical source density. We find that for medium-depth X-ray and optical images, the number of false sources detected per field is generally less than one. For example, we predict 0.6 false matches for Q2345, 0.7 false matches for CL 0442+0202, and 1.3 false matches for 1156+295, where these numbers are for the 1.5^{′′} search radius sources only. For the 34% of the sources with larger OAAs and thus larger search areas we expect a larger fraction of false matches, though still fewer than 3 per field for most fields. For example, we predict 1.3 false matches from the > 1.5^{′′} match radius sources in Q2345, 1.4 false matches in CL 0442+0202, and 2.4 false matches in 1156+295. For several of the fields, including the three example fields just mentioned, we shifted all Xray source positions by 1^′, producing a “fake” X-ray catalog, and ran the matching routine again with the average X-ray-to-optical offset forced to zero. This process, repeated with several different shifts of the X-ray source positions, gives a check on the number of false detections predicted above. For all of the fields tested the number of false detections are consistent with the values we calculate. Our spectroscopic results are also consistent with this matching scheme and will be discussed further in Paper III.

Once matching is complete, we produce first-draft optical postage stamp cutouts for our entire hard X-ray catalog (see Figure 3). Each stamp is centered on the astrometricallycorrected X-ray source position, and the size of the Chandra PSF-dependent search radius is shown by the (centered) solid circle. A dashed circle, located at the un-corrected Chandra position, illustrates the need for this offset correction. Arrows point to identified optical counterparts, while the absence of an arrow signals a non-detection. If the magnitude found

– 8 –

by SExtractor is fainter than the limiting optical image, we annotate the photometry with an asterisk. As in Paper I, a “CL” flag is added if a source is potentially within 1 Mpc of a target cluster center.

Next we visually inspect postage stamps for each X-ray source, flagging sources with potentially inaccurate photometry as required. These flags, detailed in § 4, identify sources which either (1) have multiple optical identifications within the PSF-dependent search area, or (2) are, or are near, a saturated source in our optical image. A final matching iteration is then done, excluding the newly flagged sources. We produce new optical catalogs and postage stamp cutouts, omitting stamps for the handful of saturated sources where counterpart magnitudes are drawn from the literature and the 65 SEXSI sources that either lack optical coverage in our data or have an unknown limiting magnitude due to nearby bright-source contamination (optical flag = 6, see § 4). An example of six postage stamp cutouts is included as Figure 3; the entire catalog of postage stamps is provided in the online version of the manuscript.

For the 262 sources with 22 < R_{limit} ≤ 23, 160 (61%) have identified counterparts, while for the 434 sources with 23 < R_{limit} ≤ 24, 291 (67%) have identified counterparts, and for the 167 sources with R_{limit} > 24, 124 (74%) have identified counterparts. Our total sample of 947 sources with unambiguous photometry (no contamination) identifies 603 counterparts (64%).

4. The Catalog

In Table 3 we present the catalog of 1034 hard-band SEXSI sources – the table is published in its entirety in the electronic version of the Astrophysical Journal. Columns 1 – 7 present X-ray source information for easy reference, while the optical photometric data are presented in columns 8 – 15. Complete X-ray source information is presented in Paper I, Table 4. The X-ray source positions in Table 3 are corrected for mean optical to X-ray offsets. Note that since the source names (column 1), identical to the source names in Paper I, are derived from the hard-band X-ray images, the refined positions of columns 2 – 3 will not exactly match those of column 1 (though mean offsets are typically less than 1^{′′}). Column 4 lists the off-axis angle (OAA, i.e., the angular distance, in arcmin, of the source position from the telescope aim point). The 2 – 10 keV flux (in units of 10^{−15} erg cm^{−2} s^{−1}) and detection SNR are shown in columns 5 – 6, while column 7 gives the hardness ratio, HR = (H − S)/(H + S), where H and S are the counts cm^{−2} in the 2 – 10 keV and 0.5 – 2 keV bands, respectively. Here, as distinct from Paper I, we record the hardness ratio derived from the net soft X-ray counts recorded at the hard-band source position when there was not

– 9 –

a significant soft-band source detected (in Paper I these cases are reported as HR = 1.0). In addition, for a subset of these cases, when the soft-band counts recorded at the hard-band source position were less than twice the soft-band background counts, the HR is considered a lower-limit, flagged as such in the catalog, and set to HR = (H −S_{limit})/(H +S_{limit}), where S_{limit} = 2 × soft-band background counts.

Column 8 contains an optical flag code essential to interpretation of the optical data: 0 = no optical coverage, 1 = a solid optical ID, 2 = no optical counterpart (the magnitude listed is then a lower limit), 3 = saturated in the SEXSI optical image (R-band magnitude taken from the Guide Star Catalog II (McLean et al. 2000) or a secondary source in VIZIER database), 4 = a solid ID but R-band magnitude affected by nearby bright source, 5 = more than one optical source in X-ray error circle (the source with the smallest positional offset is recorded in the table), and 6 = lower limit (no optical counterpart) but area contaminated by nearby bright source so limiting magnitude is unknown. Column 9 is the R-band magnitude of the optical counterpart, with its error shown in column 10. Column 11 gives the limiting magnitude for the image from which the optical counterpart, or a lower limit thereto, was derived. Column 12 lists Δα ≡ α_x − α_o in arcsec, where α_x is the astrometrically-corrected X-ray source RA (from column 2) and α_o is the optical counterpart RA; column 13 is the corresponding value for declination. Column 14, Δr (≡ √ Δα^2 + Δδ^2), is the X-ray to optical position difference, also in arcsec. Following Hornschemeier et al. (2001) and Stern et al. (2002a), the logarithmic X-ray-to-optical flux ratio (column 15) is given by the relation

log (f_x/f_o) = log f_x + (R/2.5) + 5.50, (3)

derived from the Kron-Cousins R-band filter transmission function.

Column 16 presents the SExtractor CLASS STAR parameter (Bertin & Arnouts 1996) for basic star-galaxy separation, with values ranging from 0.0 for significantly extended sources to 1.0 for sources consistent with perfectly stellar PSFs. The stellarity value of the 8 bright sources with optflag = 3 (from the literature) is set to 1.00. We present the stellarity data with the caveat that the values should only be used for broad separation, for example, of sources near 0 verses 1, but not for detailed quantitative analysis.

Note that for all of the optical counterpart data columns, special attention must be paid to the optical flag. For example, if the code is a 2 (optical counterpart is not detected), column 9 describes a lower limit, columns 10, 12 – 14, and 16 have no data, and the X-ray-to-optical flux ratio in column 15 is a lower limit.

– 10 –

5. Discussion

We now discuss the results of the optical identifications of the hard X-ray source counterparts and how the counterpart properties relate to the X-ray properties. Throughout this section, only sources with a solid optical counterpart or upper limit thereto are plotted and analyzed; we exclude sources with R-band magnitudes or limits contaminated by a nearby bright source and sources with more than one optical source within the identification radius. This provides a sample of 947 hard X-ray sources with unambiguous counterpart photometry, of which 603 are identifications and 344 have limits to the counterpart optical magnitude.

Figure 4 presents the R-band magnitudes, or limits thereto, plotted as a function of 2 – 10 keV X-ray flux. Dashed lines show constant X-ray-to-optical flux ratios. The bulk of the SEXSI sources have −1 < log(f_x/f_o) < 1 and are fainter than R = 20. Shallow, wide-area X-ray surveys, such as the ASCA hard X-ray survey reported by Akiyama et al. (2000), find that the majority of extremely bright X-ray sources (S_{2−10 keV} ∼> 10^{−13} erg cm^{−2} s^{−1}) are AGN and have −1 < log(f_x/f_o) < 1. Many of the SEXSI sources are likely fainter and/or more distant analogs.

As has been found in other surveys (e.g., Hornschemeier et al. 2001; Stern et al. 2002a), SEXSI detects a population of sources overluminous in the X-ray for their optical magnitudes. This population is found over the entire X-ray flux range sampled. Two explanations have been commonly discussed to explain large values of log(f_x/f_o): (i) extremely high-redshift AGNs that might have bright X-ray fluxes but faint R-band fluxes due to absorption from the Lyman transitions of hydrogen along our line of sight, or (ii) heavy obscuration by material in the host galaxy. The latter interpretation for the majority of sources is supported by near- IR studies, which find a large fraction to be very red early-type galaxies at z ∼ 1 (Mignoli et al. 2004). In addition, a number of Type II quasars, which would have similar properties, have been identified in the deepest Chandra surveys (e.g., Norman et al. 2002; Stern et al. 2002b; Dawson et al. 2003).

By virtue of the large area surveyed, SEXSI contains numerous sources with log(f_x/f_o) > 1.0 at moderate X-ray fluxes, S_{2−10 keV} ∼> 10^{−14} erg cm^{−2} s^{−1}. Many of these sources have R ∼< 24, well within the reach of 8- to 10-meter class telescopes for spectroscopic followup. These are brighter examples of the new X-ray overluminous population. Deep Survey versions of these sources are typically extremely faint — as an example, Koekemoer et al. (2004) report on seven “extreme X-ray / optical” (EXO) sources in the 2 Msec Chandra Deep Field-North (CDF-N) which, despite having extremely robust detections in the Chandra data (25 − 89 counts), remain undetected (z_{850} > 27.9, 3σ) in the Great Observatories Origins Deep Survey imaging of the CDF-N (Giavalisco et al. 2004). Fiore et al. (2003) report on the spectra of 13 sources with log(f_x/f_o) > 1 from the HELLAS2XMM survey. They find

– 11 –

8 narrow-lined sources, with L_x > 10^{44} erg s^{−1}. Our survey contains 109 such sources with log(f_x/f_o) > 1 of which 64 have an optical limiting magnitude and ∼> 20 have spectral data. These high f_x/f_o sources provide a useful catalog for future infrared surveys.

We also find a number of sources with very bright (R < 14) optical counterparts. The bulk of these sources (7 out of 8) are identified as stars in the literature.

Figure 5 presents a histogram of the number of sources in SEXSI and in the CDF- N (Alexander et al. 2003; Barger et al. 2003) as a function of hard X-ray flux and split by R-band magnitude at R = 22. This magnitude was chosen to separate our sources approximately in half. The small number of sources from images with R_{limit} < 22 were not included in this plot or in Figures 6, 7, and 8. The majority of the SEXSI sources have S_{2−10 keV} ≈ 10^{−14} erg cm^{−2} s^{−1}, a flux level that lies between the ASCA and BeppoSAX sensitivity limits and the Chandra Deep Survey capability. This important flux range corresponds to the regime in which the log N − log S relation changes slope and from which the bulk of the 2 – 10 keV X-ray background arises (Cowie et al. 2002; Harrison et al. 2003). Compared to the Deep Surveys, SEXSI has nearly an order of magnitude more sources at this X-ray depth, approximately half of which have R < 22, making them easy spectroscopic targets for 8- to 10-meter class telescopes.

Figure 6 shows the hardness ratio histogram of the SEXSI sources, again split at R = 22. The optically-brighter sources are peaked at a low hardness ratio, while the fainter sources have a much harder, and broader, distribution, showing that the optically-fainter portion of the sample has a higher fraction of sources with a flat X-ray spectral slope. The large peak of the R < 22 sources is near HR ∼ −0.5, which corresponds to a power-law photon index (Γ) between 1.8 and 1.9, a typical value for unobscured broad-line AGN. This suggests that the majority of the optically-brighter sources are broad-lined AGN. Spectroscopic followup (Paper III) will be able to specifically address this hypothesis. The harder and broader distribution of the R > 22 sources indicates that obscuration at the source is likely involved. Alexander et al. (2001) shows a similar trend in the 1 Ms CDF-N data.

Figure 7, which displays the mean hardness ratio as a function of hard-band flux separately for bright and faint counterpart magnitudes, again emphasizes that distinct populations are contributing to the overall source counts. The mean values for this figure are calculated using source HRs regardless of if they are flagged as lower limits. Setting all such flagged sources to the upper extreme, HR = 1, shifts the points only slightly, if at all. For reference, the HR of a Γ = 1.9 spectrum with varying intrinsic absorbing column density and redshift is presented in the adjacent panel. This shows that modest-redshift, heavily-obscured sources produce the highest HRs. For sources fainter than R = 22, the mean hardness ratio is essentially constant at HR = +0.15 over two orders of magnitude

– 12 –

in X-ray flux. For those sources with brighter magnitudes, however, there is a significant decline in mean hardness ratio, from HR ∼ −0.25 at S_{2−10 keV} ∼ 10^{−13} erg cm^{−2} s^{−1} to HR ∼ −0.1 at S_{2−10 keV} ∼ 10^{−15} erg cm^{−2} s^{−1}. In a simple-minded two-component model with median hardness ratios of −0.35 and +0.2 for the two source classes, the faint sources are dominated by the hard population with perhaps an admixture of 10% soft sources at all flux levels, while for the brighter sources, the ratio of hard to soft sources changes from 20:80 at S_{2−10 keV} ∼ 10^{−13} erg cm^{−2} s^{−1} to 80:20 at S_{2−10 keV} ∼ 10^{−15} erg cm^{−2} s^{−1}. This is qualitatively consistent with the log N − log S relations derived in Paper I, where we showed that hard sources follow a constant power-law over three orders of magnitude in hard-band flux, while softer sources show a distinct break at S_{2−10 keV} ∼ 10^{−14} erg cm^{−2} s^{−1}. In this picture, the soft sources are the standard, largely unobscured AGN at all redshifts, while the harder component represents the lower mean-redshift, lower-luminosity populations revealed in the Deep Surveys (e.g., Tozzi et al. 2001; Barger et al. 2002).

Figure 8 shows the hardness ratio as a function of X-ray to optical flux ratio for the SEXSI sample, again with the HR of a Γ = 1.9 spectrum with varying intrinsic absorbing column density as a function of redshift presented in the adjacent panel. The main plot shows a trend toward larger hardness ratios as f_x/f_o increases. This is in general consistent with the notion that the increasing f_x/f_o results from larger absorbing columns which attenuate the R-band flux much more severely than the hard X-ray flux (e.g., Mainieri et al. 2002). It is interesting, however, that the most extreme sources with log(f_x/f_o) > 1 are not all hard, but exhibit a wide range of HRs, implying that obscuration may not be the sole explanation for the dim optical counterparts. Fiore et al. (2003) find that for non-broad-lined sources (e.g., sources with optical spectra showing narrow AGN emission lines or early-type galaxy absorption lines) there is a linear correlation between log(f_x/f_o) and log(L_{2−10 keV}). This relationship implies that some of the high f_x/f_o sources with low HRs are high luminosity, high redshift, narrow-lined AGN.

We also explored the optical source densities in the vicinity of the X-ray sources. For each optical counterpart, we counted the number of sources in the surrounding region and compared the source density to the overall field density to calculate overdensities. We employed 20^{′′}, 30^{′′}, 40^{′′}, and 60^{′′} radius circles around each optical counterpart and counted sources with R-magnitude of |R − R_{counterpart}| < 1 and |R − R_{counterpart}| < 2 for each of the sources. We found no significant overdensities around the X-ray sources.

– 13 –

6. Summary

We present R-band imaging of ∼ 95% of the 2 – 10 keV X-ray sources in the SEXSI survey. We describe our optical data reduction and the X-ray to optical source matching algorithms employed, and present a catalog of R-band counterpart photometry and astrometry. While the power of the SEXSI sample is fully realized only with the addition of our collection of optical counterpart spectra, the photometric identification of the sources is an important step that provides clues to the composition of the source population. We find that by splitting the sources at R = 22 and analyzing each group’s X-ray properties, we begin to see the emergence of what appear to be physically distinct populations. For example we find that the hardness ratio distribution of the optically brighter sources is sharply peaked near HR ∼ −0.5, typical of unobscured AGN, while the fainter, R > 22 sources have a much broader and harder spectral distribution. The findings of this paper suggest that the analysis of optical spectral data from counterparts fainter than R = 22 (attainable with 10-meter-class telescopes), will be an essential part of exploring the X-ray background composition.

This research has made use of the NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration (NASA). Some of the data presented herein were obtained at the W.M. Keck Observatory, which is operated as a scientific partnership among the California Institute of Technology, the University of California and NASA. The Observatory was made possible by the generous financial support of the W.M. Keck Foundation. The authors wish to recognize and acknowledge the very significant cultural role and reverence that the summit of Mauna Kea has always had within the indigenous Hawaiian community. We are most fortunate to have the opportunity to conduct observations from this mountain. This work has made use of the USNOFS Image and Catalog Archive operated by the United States Naval Observatory, Flagstaff Station. The Guide Star Catalog was produced at the Space Telescope Science Institute under U.S. Government grant with data based on photographic data obtained using the Oschin Schmidt Telescope on Palomar Mountain and the UK Schmidt Telescope. This research has made use of NASA’s Astrophysics Data System. This work has been supported by NASA NAG5-6035 (DJH), as well as by a small Chandra archival grant. The work of DS was carried out at the Jet Propulsion Laboratory, California Institute of Technology, under a contract with NASA.

– 14 –

REFERENCES Abazajian, K. et al. 2003, AJ, 126, 2081 Akiyama, M. et al. 2000, ApJ, 532, 700 Alexander, D. M. et al. 2001, AJ, 122, 2156 —. 2003, AJ, 126, 539 Baldi, A., Molendi, S., Comastri, A., Fiore, F., Matt, G., and Vignali, C. 2002, ApJ, 564, 190 Barger, A. et al. 2003, AJ, 126, 632 Barger, A. J., Cowie, L. L., Brandt, W. N., Capak, P., Garmire, G. P., Hornschemeier, A. E., Steffen, A. T., and Wehner, E. H. 2002, AJ, 124, 1839 Bertin, E. and Arnouts, S. 1996, A&A, 117, 393 Brandt, W. N., Alexander, D. M., Bauer, F. E., and Vignali, C. 2004, astro-ph/0403646 Brusa, M. et al. 2003, A&A, 409, 65 Capak, P. et al. 2004, AJ, in press Cowie, L. L., Garmire, G. P., Bautz, M. W., Barger, A. J., Brandt, W. N., and Hornschemeier, A. E. 2002, ApJL, 566, L5 Crotts, A. P. S. 2001, BAAS, 33, 792 Dawson, S., McCrady, N., Stern, D., Eckart, M. E., Spinrad, H., Liu, M. C., and Graham, J. R. 2003, AJ, 125, 1236 Fiore, F. et al. 2003, A&A, 409, 79 Fukugita, M., Ichikawa, T., Gunn, J. E., Doi, M., Shimasaku, K., and Schneider, D. P. 1996, AJ, 111, 1748 Giacconi, R. et al. 2002, ApJS, 139, 369 Giavalisco, M. et al. 2004, ApJL, 600, L93 Green, P. J. et al. 2004, ApJS, 150, 43

– 15 –

Harrison, F. A., Eckart, M. E., Mao, P. H., Helfand, D. J., and Stern, D. 2003, ApJ, 596, 944 Hornschemeier, A. E. et al. 2001, ApJ, 554, 742 Kells, W., Dressler, A., Sivaramakrishnan, A., Carr, D., Koch, E., Epps, H., Hilyard, D., and Pardeilhan, G. 1998, PASP, 110, 1487 Kim, D. et al. 2003, astro-ph/0308492 Kinney, A. L., Calzetti, D., Bohlin, R. C., McQuade, K., Storchi-Bergman , T., and Henrique, R. 1996, ApJ, 467, 38 Koekemoer, A. M. et al. 2004, ApJL, 600, L123 Kron, R. G. 1980, ApJ, 43, 305 Landolt, A. U. 1992, AJ, 104, 340 Mainieri, V., Bergeron, J., Hasinger, G., Lehmann, I., Rosati, P., Schmidt, M., Szokoly, G., and Della Ceca, R. 2002, A&A, 393, 425 McLean, B. J., Greene, G. R., Lattanzi, M. G., and Pirenne, B. 2000, in ASP Conf. Ser.

216: ADASS IX, 145 Mignoli, M. et al. 2004, astro-ph/0401298 Monet, D. G. 1998, BAAS, 30, 1427 Monet, D. G. et al. 2003, AJ, 125, 984 Norman, C. et al. 2002, ApJ, 571, 218 Oke, J. B. et al. 1995, PASP, 107, 375 Simcoe, R. A., Metzger, M. R., Small, T. A., and Araya, G. 2000, BAAS, 32, 758 Stern, D. et al. 2002a, AJ, 123, 2223 —. 2002b, ApJ, 568, 71 Tozzi, P. et al. 2001, ApJ, 562, 42 Vanden Berk, D. E. et al. 2001, AJ, 122, 549

– 16 –

Weisskopf, M. C., O’dell, S. L., and van Speybroeck, L. P. 1996, in Proc. SPIE Vol. 2805, p. 2-7, Multilayer and Grazing Incidence X-Ray/EUV Optics III, Richard B. Hoover; Arthur B. Walker; Eds., 2

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 17 –

Table 1. Optical imaging instruments employed in the SEXSI survey.

Plate Scale Camera Telescope [^{′′}/pix] FOV Reference

8K MDM 2.4m 0.18 24.6^′ × 24.6^′ Crotts (2001) CCD13 Palomar 60” 0.37 12.6^′ × 12.6^′ Cosmic Palomar 200” 0.29 9.9^′ × 9.9^′ Kells et al. (1998) Echelle MDM 1.3m 0.50 17.1^′ × 17.1^′ Echelle MDM 2.4m 0.28 9.6^′ × 9.6^′ LFC Palomar 200” 0.18 ∼ π(12.3^′)^2 Simcoe et al. (2000) LRIS Keck I 0.22 7.5^′ × 7.5^′ Oke et al. (1995) Templeton MDM 1.3m 0.50 8.5^′ × 8.5^′

– 18 –

Table 2. SEXSI optical imaging.

X-ray Optical Images Exp. ⟨Δα_{xo}⟩ ⟨Δδ_{xo}⟩ extinction^a RA DEC Camera R limit^b Seeing Target [ks] [^{′′}] [^{′′}] [R Mag] (J2000) (J2000) [Mag] [^{′′}]

NGC 891 51 -0.9 ± 0.3 0.6 ± 0.2 0.17 02 22 40 +42 26 16 8K 24.3 1.6 AWM 7 48 0.5 ± 0.3 0.2 ± 0.1 0.30 02 54 45 +41 40 10 8K 24.2^c 1.7 XRF 011130 30 0.4 ± 0.2 -0.5 ± 0.2 0.26 03 05 28 +03 48 52 LFC 23.2^d 1.2 NGC 1569 97 -0.3 ± 0.2 0.6 ± 0.3 2.00^e 04 29 08 +64 45 42 Echelle (1.3) 21.5 1.7 04 29 42 +64 42 35 LRIS 21.5 0.9 04 29 53 +64 39 47 CCD13 21.0 1.4 04 30 36 +64 51 06 LRIS 23.0 1.2 04 31 15 +64 51 06 LRIS 22.5 0.9 3C 123 47 -0.1 ± 0.1 0.0 ± 0.0 2.61^e 04 36 52 +29 40 08 8K 21.9 1.4 CL 0442+0202^f 44 -0.2 ± 0.2 -1.2 ± 0.3 0.41 04 42 17 +02 03 35 LFC 21.1^d 1.2 CL 0848+4454 186 -0.3 ± 0.1 -1.2 ± 0.1 0.08 04 48 49 +44 54 09 LFC 24.4^d 1.1 RX J0910 171 -0.3 ± 0.1 -2.3 ± 0.2 0.05 09 10 33 +54 19 38 8K 24.0 1.6 1156+295 49 -0.5 ± 0.2 -1.1 ± 0.3 0.05 11 59 32 +29 16 19 8K 24.5 1.5 NGC 4244 49 -0.2 ± 0.2 0.0 ± 0.1 0.06 12 16 46 +37 51 46 CCD13 22.9^d 1.8 12 17 34 +37 46 54 Echelle (1.3) 23.4^d 1.8 12 17 54 +37 55 15 CCD13 23.4^d 1.5 NGC 4631 59 0.4 ± 0.3 -0.3 ± 0.2 0.05 12 41 29 +32 36 46 CCD13 23.0^d 1.6 12 41 39 +32 30 44 CCD13 23.0^d 2.5 12 42 03 +32 40 53 Echelle (2.4) 23.0^d 1.2 12 42 21 +32 37 09 CCD13 23.0^d 1.7 12 42 59 +32 32 49 Templeton 23.0^d 1.4 HCG 62 49 0.1 ± 0.1 -0.1 ± 0.1 0.13 12 53 04 −09 14 20 Echelle (2.4) 22.4^d 1.2 12 53 06 −09 05 48 Echelle (2.4) 23.4^d 1.0 12 53 04 −09 14 20 CCD13 22.4^d 1.6 RX J1317 111 -1.6 ± 0.2 -1.6 ± 0.2 0.03 13 17 13 +29 11 32 LFC 23.5^d 1.5 BD 1338 38 -1.3 ± 0.2 -1.1 ± 0.1 0.04 13 37 44 +29 25 24 CCD13 22.5 1.3 13 37 53 +29 29 44 CCD13 22.5 1.7 13 38 15 +29 36 51 CCD13 22.5 2.0 13 38 26 +29 24 53 CCD13 22.5 1.5 RX J1350 58 0.7 ± 0.3 -2.5 ± 0.5 0.03 13 50 39 +60 04 11 LFC 22.5^g 0.9 3C 295 23 0.2 ± 0.2 -0.3 ± 0.3 0.05 14 11 01 +52 21 18 CCD13 22.5^d 2.2 14 11 24 +52 13 36 CCD13 21.5^d 2.8 14 11 46 +52 05 42 CCD13 22.0^d 2.3 GRB 010222 18 -0.6 ± 0.2 0.1 ± 0.1 0.06 14 51 59 +43 08 54 CCD13 21.9 2.1 14 52 13 +43 01 06 CCD13 22.9 1.4

– 19 –

Table 2—Continued

X-ray Optical Images Exp. ⟨Δα_{xo}⟩ ⟨Δδ_{xo}⟩ extinction^a RA DEC Camera R limit^b Seeing Target [ks] [^{′′}] [^{′′}] [R Mag] (J2000) (J2000) [Mag] [^{′′}]

14 52 43 +42 55 12 CCD13 22.4 1.6 14 52 59 +43 06 07 CCD13 22.9 1.3 QSO 1508 89 -0.6 ± 0.2 -0.2 ± 0.1 0.03 15 09 50 +57 04 16 LFC 24.0^g 1.2 MKW 3S 57 -0.8 ± 0.1 0.1 ± 0.1 0.09 15 21 30 +07 47 43 CCD13 23.4 1.2 15 21 37 +07 39 08 CCD13 22.9 1.1 15 22 12 +07 48 36 CCD13 22.9 1.3 15 22 13 +07 47 21 CCD13 22.9 1.6 MS 1621 30 -1.2 ± 0.1 0.3 ± 0.2 0.09 16 23 06 +26 36 33 CCD13 22.4 2.3 16 23 13 +26 30 22 Cosmic 24.4 1.4 16 23 26 +26 38 28 Cosmic 23.9 1.6 16 23 42 +26 43 49 CCD13 22.9 2.3 16 24 03 +26 35 32 Cosmic 23.9 1.2 GRB 000926 32 -0.7 ± 0.2 -0.6 ± 0.3 0.08 17 03 19 +51 47 58 8K 22.9 1.2 RX J1716 52 -0.5 ± 0.1 1.2 ± 0.1 0.09 17 15 36 +67 19 45 CCD13 22.4 1.7 17 15 55 +67 05 59 Cosmic 24.4 1.3 17 16 39 +67 13 27 Cosmic 23.9 1.4 17 17 11 +67 01 40 Cosmic 24.4 1.2 17 17 42 +67 12 36 CCD13 22.9 1.3 17 17 56 +67 09 08 Cosmic 23.9 1.6 17 18 04 +67 12 01 CCD13 22.4 2.2 NGC 6543 46 -0.5 ± 0.2 -0.2 ± 0.1 0.12 17 57 44 +66 44 40 CCD13 22.9 1.3 17 58 31 +66 34 02 CCD13 22.9 1.4 18 00 25 +66 30 52 CCD13 22.9 1.2 XRF 011030 47 -0.2 ± 0.2 -0.4 ± 0.2 1.09^e 20 44 02 +77 21 06 LFC 21.4^d 2.2 MS 2053 44 -1.1 ± 0.1 0.4 ± 0.1 0.22 20 55 48 −04 31 10 CCD13 22.8 1.7 20 55 59 −04 35 47 Cosmic 23.8 1.4 20 56 09 −04 44 01 Cosmic 23.8 1.4 20 56 30 −04 38 17 LRIS 23.8 1.0 20 56 33 −04 30 53 CCD13 22.3 2.1 20 56 42 −04 41 28 Cosmic 23.8 1.2 RX J2247 49 -0.8 ± 0.1 1.0 ± 0.1 0.15 22 47 21 +03 39 25 8K 23.4 1.7 Q2345 74 0.0 ± 0.1 -0.3 ± 0.2 0.07 23 48 25 +01 01 12 8K 23.4^d 1.5

aError on Galactic R-band extinction is ∼ 0.02, with exceptions noted. This error is generally an order of magnitude smaller than the error on the zeropoint magnitude.

– 20 –

bImage R-band limits are Galactic extinction-subtracted and correct to within 0.5 mag. cimiting magnitude estimated from visual inspection; the nearby cluster sources skew the R-band number counts distribution and gave an unreasonable limiting magnitude from our automated algorithm.

dZeropoint derived using USNO-B1.0 catalog. No SDSS coverage available. eError on Galactic R-band extinction is ∼ 0.2.

f In Paper I, Table 2, CL 0442+0202 was erroneously referred to as “CL 0442+2200”. gZeropoint derived using SDSS 1st data release.

– 21 –

Table 3. SEXSI optical counterpart catalog.

X-ray Data Optical Counterpart Data CXOSEXSI 2 – 10 keV α_x (J2000) δ_x (J2000) OAA Flux SNR HR Flag R σ_R R_{limit} Δα Δδ Δr log^{fx}_{fo} Stel.

(1) (2)^a (3)^a (4) (5) (6) (7)^b (8)^c (9) (10) (11) (12) (13) (14) (15) (16)

J022142.6+422654 02 21 42.75 +42 26 53.5 9.49 23.10 2.83 -0.33 1 18.73 0.16 24.3 1.0 1.8 2.1 -0.64 0.66 J022143.6+421631 02 21 43.72 +42 16 31.0 8.33 74.80 8.81 -0.28 6 . . . . . . . . . . . . . . . . . . . . . . . . J022151.6+422319 02 21 51.76 +42 23 18.7 6.17 6.55 2.06 -0.16 2 24.3 . . . 24.3 . . . . . . . . . 1.04 . . . J022204.9+422338 02 22 05.08 +42 23 37.7 4.24 8.73 2.74 0.84^d 1 20.37 0.16 24.3 -0.2 0.5 0.5 -0.41 0.02 J022205.1+422213 02 22 05.21 +42 22 12.7 3.45 6.82 2.38 0.07 2 24.3 . . . 24.3 . . . . . . . . . 1.07 . . . J022207.1+422918 02 22 07.19 +42 29 18.2 8.93 18.90 3.84 -0.33 1 21.56 0.16 24.3 2.3 -0.8 2.4 0.40 0.96 J022210.0+422956 02 22 10.08 +42 29 55.7 9.38 17.30 3.52 -0.62 1 18.88 0.16 24.3 0.2 -0.6 0.6 -0.71 0.03 J022210.8+422016 02 22 10.93 +42 20 16.1 2.17 3.63 1.53 -0.46 1 21.57 0.17 24.3 0.6 -0.4 0.8 -0.31 0.95 J022211.7+421910 02 22 11.79 +42 19 10.1 2.55 6.87 2.36 0.14 6 . . . . . . . . . . . . . . . . . . . . . . . . J022215.0+422341 02 22 15.12 +42 23 41.0 3.15 15.40 3.88 -0.41 1 22.52 0.18 24.3 0.1 0.0 0.1 0.70 0.64 J022215.1+422045 02 22 15.19 +42 20 44.5 1.32 42.90 7.49 -0.42 1 17.33 0.16 24.3 -0.3 0.1 0.3 -0.94 0.03 J022215.5+421842 02 22 15.63 +42 18 41.7 2.46 6.79 2.34 0.28 1 20.33 0.16 24.3 -0.4 0.1 0.4 -0.54 0.03 J022219.3+422052 02 22 19.40 +42 20 51.6 0.54 6.38 2.31 0.37 1 23.82 0.22 24.3 -0.9 0.6 1.1 0.83 0.38 J022224.3+422138 02 22 24.45 +42 21 38.4 0.91 64.60 8.92 -0.44 1 17.41 0.16 24.3 0.0 0.0 0.0 -0.73 0.98 J022225.2+422451 02 22 25.33 +42 24 50.9 4.07 128.00 12.99 -0.34 1 19.31 0.16 24.3 0.1 0.2 0.2 0.33 0.98 J022226.5+422154 02 22 26.63 +42 21 54.4 1.35 6.48 2.32 -0.35 2 24.3 . . . 24.3 . . . . . . . . . 1.04 . . . J022232.5+423015 02 22 32.61 +42 30 14.6 9.61 53.60 6.50 0.12 1 20.88 0.16 24.3 0.4 0.4 0.5 0.58 0.77 J022236.3+421730 02 22 36.45 +42 17 30.2 4.23 12.00 3.30 0.01 1 22.38 0.18 24.3 0.3 -0.9 1.0 0.53 0.42 J022236.7+422858 02 22 36.88 +42 28 57.7 8.57 12.90 3.00 -0.68 1 22.05 0.17 24.3 -1.5 2.1 2.6 0.43 0.81 J022259.1+422434 02 22 59.18 +42 24 33.6 7.77 32.50 5.43 0.49 2 24.3 . . . 24.3 . . . . . . . . . 1.74 . . . J022334.0+422212 02 23 34.13 +42 22 11.6 13.34 37.50 4.47 0.15 2 24.3 . . . 24.3 . . . . . . . . . 1.81 . . .

– 22 –

Note. — Table 3 is published in its entirety in the electronic version of the Astrophysical Journal. A portion is shown here for guidance regarding its form and content.

aX-ray positions are corrected for average X-ray to optical offset (to correct Chandra astrometry).

bNote that the HRs presented here for sources with soft-band counts that did not meet our detection criteria are calculated differently than they were in Paper I. Please see §4 for detail.

cSee §4 for details of the flag code. Briefly: 0 = no optical coverage, 1 = solid optical ID, 2 = upper limit, 3 = saturated in SEXSI optical image; R-band magnitude taken from the Guide Star Catalog II (McLean et al. 2000), 4 = solid ID but R-band magnitude affected by nearby bright source, 5 = more than one optical source consistent with the X-ray source position, 6 = upper limit (no optical counterpart) but area contaminated by nearby bright source so limiting magnitude is unknown.

dHR is lower limit.

eSource falls within an area potentially less than 1 Mpc from a target cluster center. Source was not used for 2 – 10 keV log N − log S calculation in Paper 1.

– 23 –

Fig. 1.— Example of R-band number counts for a typical SEXSI image: the Q2345 number counts from our MDM 2.4-meter/8K image is shown as a thick, solid histogram. The Capak et al. (2004) fit to deep imaging number counts is shown as a thin, solid line. Our 80% completeness limit (vertical dashed line) determination is described in § 2.2.

– 24 –

Fig. 2.— Histogram of limiting optical magnitudes for all SEXSI sources with optical coverage, excluding sources with non-detections where the background is contaminated by a nearby bright source (optflag = 6, see § 4). Most sources have limiting magnitudes of at least R = 23.

– 25 –

Fig. 3.— Example of the R-band postage stamp cutout images. Cutouts for the full catalog of hard-band SEXSI sources with optical follow-up are presented in the online version of the paper (Figures 3b – 3do); we show representative images from the RX J0910 field here. Images are centered at the astrometrically-corrected Chandra source positions, and the image orientation is shown in the upper-right corners (North has the arrowhead, East lacks an arrowhead). The dashed circles are centered on the original X-ray-derived source positions, while the solid circles show X-ray source positions corrected for the Chandra pointing error; circle radii are a function of X-ray off-axis angle as described in the text. Arrows point to the optical counterpart if one is present. Text above each cutout identifies the source and labels its 2 – 10 keV flux (in units of 10^{−15} erg cm^{−2} s^{−1}), hardness ratio HR (defined in § 4), and R-band magnitude or the limit thereto. Flags on the R-band photometry are also presented, though no flagged sources are shown in the example figure. A dagger (†) indicates that the counterpart is near a bright source, affecting the R-magnitude, a double-dagger (‡) flags cases where there is more than one optical source within the search area, and an asterisk (∗) indicates that the R-band magnitude is higher than the limiting magnitude of the image. Additionally, CL denotes a source potentially falling within 1 Mpc of a target cluster center (see § 3).

– 26 –

Fig. 4.— Optical magnitude of SEXSI sources, plotted as a function of their hard-band (2 – 10 keV) X-ray flux. Dashed, angled lines show constant log (f_x/f_o). Plus signs show sources with optical counterparts, crosses are sources with a SExtractor ID but where R > R_{limit}, while arrows denote sources lacking counterparts to the image R-band limit. Star symbols show SEXSI sources identified as stars in the literature (only sources with log (f_x/f_o) < −1 were checked).

– 27 –

Fig. 5.— Histogram of 2 – 10 keV fluxes, split by optical counterpart R-band magnitude. Heavy lines show SEXSI sources; lighter lines show sources from the CDF-N (Alexander et al. 2003; Barger et al. 2003). For both, solid lines refer to optically-brighter sources (R < 22.0), while dashed lines refer to optically-fainter sources (R > 22.0). CDF-N X-ray fluxes have been converted from the published 2 – 8 keV values to the 2 – 10 keV fluxes plotted here. This involved converting X-ray photon indices Γ from the individually-derived indices used in the CDF-N X-ray catalog (Alexander et al. 2003) to the average Γ = 1.5 adopted by the SEXSI project. In addition, the sources with R_{limit} < 22.0 were excluded from the plot.

– 28 –

Fig. 6.— Histogram of X-ray hardness ratios (HR), split by optical counterpart R-band magnitude. The solid line shows optically-brighter (R < 22.0) sources, while the dashed line shows optically-fainter (R > 22.0) sources; objects with limiting HRs are included in these histograms, plotted at the limiting HR. The filled histograms present only the sources with limiting HR for R > 22 (gray) and R < 22 (black).

– 29 –

Fig. 7.— Mean hardness ratio (HR) of sources split by optical counterpart R-band magnitude, as a function of 2 – 10 keV flux. Sources were split at R = 22.0 and then binned into four equally spaced logarithmic X-ray flux bins. Note that at each X-ray flux, the optically faint sources (asterisks) are significantly harder than the brighter optical sources (squares). The right panel shows HR as a function of redshift for an intrinsic Γ = 1.9 spectrum with several intrinsic obscuring column densities, for reference.

– 30 –

Fig. 8.— Hardness ratio as a function of X-ray-to-optical flux ratio. Sources with identified optical counterparts are shown with filled (R < R_{limit}) and open (R > R_{limit}) circles; sources with an optical limit are shown as right-pointing arrows – the f_x/f_o value is a lower limit. Vertical arrows indicate a lower limit to the HR. The right panel shows HR as a function of redshift for an intrinsic Γ = 1.9 spectrum with several intrinsic obscuring column densities, for reference.