arXiv:astro-ph/0401102v1 8 Jan 2004

Astronomy & Astrophysics manuscript no. AA0464 April 3, 2018 (DOI: will be inserted by hand later)

Fe XIII coronal line emission in cool M dwarfs^⋆

B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann

Hamburger Sternwarte, University of Hamburg, Gojenbergsweg 112, D-21029 Hamburg e-mail: bfuhrmeister@hs.uni-hamburg.de

the date of receipt and acceptance should be inserted later

Abstract. We report on a search for the Fe xiii forbidden coronal line at 33881.1 Å in a sample of 15 M-type dwarf stars covering the whole spectral class as well as different levels of activity. A clear detection was achieved for LHS 2076 during a major flare and for CN Leo, where the line had been discovered before. For some other stars the situation is not quite clear. For CN Leo we investigated the timing behaviour of the Fe xiii line and report a high level of variability on a timescale of hours which we ascribe to microflare heating.

Key words. stars: activity – stars: coronae – stars: late-type

1. Introduction

The solar corona can be studied at extremely high spatial and spectral resolution over almost the entire range of the electromagnetic spectrum. With typical coronal plasma temperatures of a few million degrees the bulk of the Sun’s coronal energy losses is emitted in the X-ray range, the energy losses at shorter and longer wavelengths being considerably smaller. Therefore observations of the solar corona in the optical are quite difficult because of the faintness of the corona compared to the photosphere in this wavelength range. This problem can be overcome at least for observations above the solar limb if the photospheric light is blocked, e.g. by the Moon during an eclipse or – artificially – by a coronograph. Optical observations of the solar corona carried out in that fashion were the first to reveal the true nature of the corona as a hot plasma with temperatures much higher than the underlying chromosphere or photosphere. However, the solar corona could only be observed off the limb in the optical, and only through satellite-based imaging observations of the corona at X-ray and EUV wavelengths the corona at large could be observed and studied.

The existence of coronae similar to that of the Sun around essentially all late-type main sequence stars with outer convection zones has been established by extensive X-ray studies (e. g. Schmitt (1997)). As is the case for the Sun, the bulk of the energy losses for stellar coronae also occurs in the Xray range, and consequently this spectral band is the most natural one for the study of stellar coronae. However, coronal emission from stars can also be observed in the radio range (e. g. Berger (2002) or Güdel (2002)) and in the optical (Schmitt & Wichmann (2001)). Coronal observations at

Send offprint requests to: B. Fuhrmeister ⋆ Based on observations collected at the European Southern Observatory, Paranal, Chile, 68.D-0166A.

those latter wavebands are extremely difficult since the coronal emissions are much fainter, and especially in the optical, the weak coronal emission has to be detected above the usually much brighter optical photospheric emission. The most promising candidates to search for optical coronal emission are clearly late-type M dwarf stars, which can be as X-ray bright as or even X-ray brighter than the Sun, but whose photospheric emission is rather faint in particular at near UV wavelengths. The detection of coronal emission in the optical was recently accomplished for the active M-star CN Leo, where Schmitt & Wichmann (2001) were able to detect the Fe xiii forbidden coronal line at 3388.1 Å. This successful detection of coronal emission in one star raises the question to what extent such detections are possible for other cool stars as well or whether CN Leo is a unique and singular case.

In this paper we will discuss the problems of detecting the 3388.1 Å forbidden coronal line in a small sample of late-type stars and present an analysis of the temporal variability of this line in the ”proto-type” CN Leo. Our paper is structured as follows: In section 2 we describe the VLT data used for our analyses and the sample of investigated stars. In section 3 an overview over the spectral range under investigation is given, while in section 4 we deal with the rotational velocity of the analyzed stars. In section 5 the results of our search for the Fe xiii line for individual stars are presented and the timing behavior of the line for CN Leo is discussed in section 6. Section 7 deals with the X-ray to Fe xiii line ratio for CN Leo and LHS 2076. In section 8 we describe the results of our search for other forbidden coronal lines in CN Leo.

2. Observations and data analysis

The observations reported in this paper were obtained in visitor mode with ESO’s Kueyen telescope at Paranal equipped

2 B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars

with the Ultraviolet-Visual Echelle Spectrograph (UVES) from March, 13th to 16th in 2002, with the exception of UV Ceti, Prox Cen, LHS 292 and one of the CN Leo spectra, which were observed in service mode during the winter season 2000/2001. For the March 2002 run the instrument was operated in a dichroic mode, yielding 33 echelle orders in the blue arm (spectral coverage from 3030 to 3880 Å) and 39 orders in the red arm (spectral coverage from 4580 to 6680 Å). For the runs in the winter 2000/2001 a monochroic setup was used, providing us only with the blue part of the spectrum. In the dichroic setup the red part of the spectrum is recorded on two separate CCDs; therefore there is a spectral gap from ∼ 5640 to 5740 Å, resulting from a spatial gap between the two CCDs. As a consequence of the various instrumental constraints we cannot observe the lines from H_3 up to H_8 of the Balmer series, nor do we cover the Ca ii H and K lines. The typical resolution of our spectra is ∼ 45000, typical exposures times were 20 minutes except for the brighter among our sample stars. Normally for each star three exposures were taken in sequence in order to facilitate the recognition of cosmics, again with the exception of the four spectra of CN Leo, UV Ceti, Prox Cen and LHS 292 taken during the winter season 2000/2001.

A list of the observed stars and the available spectra for each star is provided in Table 1, giving the observation dates and total exposure times. Moreover we provide some basic parameters of the sample stars, including the highest detected Balmer line in our data as an estimator of activity. Note that during the March 2002 run CN Leo was observed nightly to carry out an investigation of its chromospheric and coronal variability.

All data were reduced using IRAF, including flat-fielding, order definition and scattered light subtraction. The wavelength calibration was carried out using Thorium-Argon spectra with an accuracy of ∼ 0.03 Å in the blue arm and ∼ 0.05Å in the red arm. In addition there are photometric data from the UVES exposure meter taken for engineering purposes and therefore not flux calibrated. Still, these data were useful to assess whether the star was observed during quiescence or during a major flare.

The spectral line fits were carried out with the CORA fit program (Ness & Wichmann 2002). This software tool was originally developed for analyzing high resolution X-ray spectra, but the fit algorithms employed by CORA are also well suited for the modeling of well-defined chromospheric and coronal emission lines. The program provides an accurate error analysis. All fits were carried out using Gaussian line profiles after shifting the wavelength to the stars’ rest frame.

3. Detection of the Fe xiii line

The prime target of our observing program was the spectral region around 3388 Å. The specific transition under consideration is 3s^23p^{2 3} P_2 −^1 D_2. Flower & Pineau des Forets (1973) give a detailed discussion of the atomic physics of Fe xiii and provide level population calculations for a range of temperatures and densities, considering direct excitation due to collisions with electrons and protons and indirect excitation of allowed transitions via collisions with electrons followed by radiative decay and find rather low dependence on temperature.

In order to give an overview of the nature and quality of our spectra, we show (in Fig. 1) the spectral range between 3370 Å - 3390 Å for most of our program stars. LHS 292 is not shown since its spectrum is very similar to DX Cnc, and LHS 428 and LHS 6158 are not shown since they are both double stars with very complicated spectra that could not be disentangled and were therefore excluded from the analysis. The spectra shown in Fig. 1 are sorted by decreasing spectral type. One notes a distinct sequence from “early” M dwarfs to “late” M dwarfs. In the “early” M dwarfs like Gl 229A and AD Leo one still recognizes a clear photospheric spectrum in the range 3370 Å - 3390 Å with some additional chromospheric emission lines, while in the later type M dwarfs like CN Leo and the (flaring) LHS 2034 an almost pure emission line spectrum appears; these latter spectra are obviously dominated by the stellar chromospheres rather than their photospheres.

The Fe xiii line at 3388.1 Å detected in CN Leo by Schmitt & Wichmann (2001) is – unfortunately – blended with a Ti ii chromospheric line at 3387.846 Å.This particular Ti ii line and other emission lines from the same multiplet are present in all recorded spectra besides the non-flare spectra of LHS 2034 and LHS 2076 and the spectrum of DX Cnc. In GL 229A Ti ii appears to be present in absorption.

The stars earlier than M4.5 have a rather high pseudocontinuum in the considered wavelength range which is clearly dominated by overlapping absorption lines. This continuum strongly decreases for the spectral types M3.5 - M4.5 stars by a factor of ten, accompanied by the vanishing of the strong absorption features in this regime. Consequently, a detection of the Fe xiii line should be much easier for spectral types later than M4.5. Therefore the most promising search for coronal line emission can be made for stars in the spectral range M4.5 - M6 since for later stars even the normally strong chromospheric Ti ii emission lines cannot be detected any more.

4. Determination of rotational velocities

A critical issue for the successful separation of the chromospheric Ti II emission line at 3387.846 Å and the coronal Fe XIII emission line at 3388.1 Å are the intrinsic line broadening profiles of these lines. The wavelength difference between those lines (≈ 0.26 Å) corresponds to a velocity of ≈ 23 km/sec, easily within the reach of thermal and rotational velocities. Obviously, the thermal broadening profiles differ substantially because of the different origins of these lines, and rapid rotation is expected at least for the more active stars. Since we clearly need accurate values for v sin(i) for disentangling the Ti II and Fe XIII emission lines, we decided to measure it for some of our program stars. In order to determine v sin(i) we used 18 of the red arm orders that show no strong emission lines either from the star or from terrestrial airglow. As a template we decided to use CN Leo since CN Leo is known to rotate very slowly (v sin(i) < 2.9kms^{−1} (Delfosse et al. 1998)). The measured spectrum of CN Leo was spun up with rotational velocities from 3 up to 45 kms^{−1}. The best fit value for the rotation velocity v sin(i) of the spun up template and the star under study was determined with a χ^2-test for every order used. The final rotational velocity was determined by averaging the val-

B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars 3

Fig. 1. The considered wavelength range of selected program stars. Some strong absorption lines are identified in the top spectrum. The Ti ii emission lines are marked in the spectrum of Ad Leo.

4 B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars

Fig. 1. (continued) For LHS 2034 and LHS 2076 the spectra are shown during flare and during quiescent state. Note that these four spectra and the spectrum of UV Cet are not averaged spectra and therefore some remaining cosmics were replaced manually by a straight line.

B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars 5

Table 1. Basic observations parameters of the observed stars.

name other spectral log L_X^1 observations Ti ii lines highest name type Balmer line LHS 1827 GJ 229A M1 27.13^a 2002-03-15 4 spectra 1200s absorption - LHS 428 M3e 28.75^a 2002-03-15 2 spectra 1200s absorption H_{18} LHS 6158 M3.5 28.76^c 2002-03-15 2 spectra 2400s weak absorption H_{18} LHS 5167 AD Leo M3.5 28.92^a 2002-03-13 3 spectra 1800s emission H_{18} 2002-03-16 2 spectra 1200s HD 196982 AT Mic M4.5 29.55^c 2002-03-16 2 spectra 2400s emission H_{20} LHS 1943 YZ CMi M4.5e 28.67^b 2002-03-13 3 spectra 3600s emission H_{24} LHS 2664 FN Vir M4.5 27.92^b 2002-03-13 3 spectra 3600s weak emission H_{18} LHS 324 GL Vir M5 27.65^a 2002-03-13 3 spectra 3600s weak emission H_{19} 2002-03-16 2 spectra 2400s LHS 36 CN Leo M5.5 27.78^a 2002-03-13 6 spectra 7200s emission H_{24} 2002-03-14 4 spectra 4800s 2002-03-15 6 spectra 7200s 2002-03-16 6 spectra 7200s 2001-01-06 1 spectrum 3120s LHS 2076 EI Cnc M5.5 27.60^a 2002-03-15 4 spectra 4800s - H_{18} 2002-03-16 1 spectrum 1200s LHS 49 Prox Cen M5.5 27.26^a 2001-02-02 1 spectrum 3120s weak emission H_{18} LHS 10 UV Cet M5.5 27.31^a 2000-12-17 1 spectrum 3120s emission H_{18} LHS 248 DX Cnc M6 26.60^a 2002-03-16 3 spectra 3600s - H_{11} LHS 2034 AZ Cnc M6 28.89^c 2002-03-14 6 spectra 6000s emission H_{17} 2002-03-16 2 spectra 2400s LHS 292 M6.5 2001-02-02 1 spectrum 3120s - H_{15} 1 in erg s^{−1} a Schmitt et al. (1995) b Delfosse et al. (1998) c Hünsch et al. (1999) d Schmitt & Liefke (2002) X-ray luminosity is variable

ues obtained in the different orders. We mostly used only the red part of the spectrum since in the blue part of the spectrum it is rather difficult to find larger regions unaffected by emission lines. We tried to avoid this problem of the blue spectra by using only very narrow spectral ranges (∼ 10Å) of every aperture, yet the issues of which lines are in emission, which show emission cores and which are purely in absorption are very different for each program star. Therefore the template has to be very similar to the test star and the used wavelength intervals have to be determined individually but even then the scatter for the wavelength intervals is bigger than in the red arm. Therefore we determined the rotational velocity for only three stars in the blue arm. For these stars we used Prox Cen as template since its spectrum is very similar to these stars. CN Leo could not be used as template because it is much more active than the measured stars. The rotational velocities determined in this fashion are listed in Table 2. In general, the values determined by us agree with previously determined ones found in the literature with the exception of GL Vir, where we find a substantially larger rotational velocity both in the red and blue arm than Delfosse et al. (1998). A careful visual inspection and comparison of the spectra of GL Vir with those obtained for FN Vir and AD Leo shows a very high similarity to the faster rotating spectrum. Moreover we used a template star very similar to GL Vir in spectral type while Delfosse et al. used a synthetic K0III spectrum. Therefore we do favor our (larger) rotational velocity.

Table 2. Rotational velocities for (some of) our program stars. LHS 428 is omitted because it is a double star and could not be separated. LHS 6158 even seems to be a triple system. GJ 229A is saturated in the red arm. Prox Cen was used as template for UV Cet, FN Vir and GL Vir in the blue arm. All measurements in km s^{−1}.

star v sin(i) v sin(i) literature red arm blue arm AD Leo 7.6 ± 1.2 6.2 ± 0.8^1 AT Mic 11.7 ± 0.9 YZ CMi 6.7 ± 0.6 7.0 ± 2.0^2, 6.5± 1.1^1 FN Vir 17.4 ± 1.4 13.1 ± 3.7 16.8 ± 2.1^1 GL Vir 15.3 ± 0.8 16.0 ± 2.0 9.2 ± 1.9^1 UV Cet B 32.5 ± 2.0^2 UV Cet A - 25.9 ± 8.6 DX Cnc 8.9 ± 0.8 11.0 ± 2.0^2, 8.1 ± 1.1^1 LHS 2034 7.9 ± 2.8 1 Delfosse et al. (1998) 2 Mohanty & Basri (2003)

For the double star UV Cet we measure a rotational velocity of 25.9 ± 8.6 km s^{−1} which agrees with the value found by Mohanty & Basri (2003) for UV Cet B. Since UV Cet A has a similar rotation velocity (G. Basri, private communication) it cannot be decided from the rotational velocity which component of UV Cet dominates our spectrum.

6 B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars

5. Observations of individual stars

Since the spectral properties of our sample stars are very different we applied specific methods for the individual stars for a detection or non-detection of the Fe xiii line. These are discussed in detail below.

5.1. CN Leo

We report a clear detection of the Fe xiii line for CN Leo, which is also found to be variable on a timescale of hours, as will be discussed in section 6. Thus the Fe XIII line detection of Schmitt & Wichmann (2001) is fully confirmed.

5.2. LHS 2076

A clear detection of the Fe xiii 3388.1 Å emission line has been obtained during a flare on LHS 2076. LHS 2076 is a double star known for its flare activity and separated by 3^{′′}.4 with both components being late-type (Pettersen 1985). Our spectrum refers to one system component with some minor contribution from the second star. During the last of the four exposures on March, 15th a double-peaked flare can be recognized in the photometer light curve as shown in Fig. 2.

Outside the flare interval no significant Ti ii emission is detectable in the spectra. The emission line properties of the flare spectrum are listed in Table 3. The emission feature at 3387 Å is quite broad and was fitted with a double line component with amplitude, central wavelength and FWHM for both components as free parameters. The other Ti ii lines were fitted as single lines with all three parameters (λ_{cen}, A and σ) free. Inspecting the properties of these three Ti ii lines (cf., Table 3) one finds that the fitted half widths of all three lines agree very well with each other as expected for lines from the same multiplet. The half width of the narrow component of the 3387 Å line also agrees well with the half widths of the three Ti ii lines while the half width of the broad component is more than three times larger. We therefore conclude that the narrow component of the broad emission feature at 3387 Å must be the fourth Ti ii line in the multiplet, while the broad component has to be identified with the Fe xiii line. Further evidence for this interpretation can be found from the lines’ amplitudes. Atomic data available through the NIST atomic spectra database^1 for these lines predict equal relative intensities for the two lines at 3372.80 and 3383.77 Å and equal relative intensities for the two lines at 3380.28 and 3387.84 Å lowered by a factor of four compared to the former two lines. According to Table 3 the amplitudes of the 3372.80 and 3383.77 Å line agree to within the errors and the two other lines are weaker. Therefore the broad component cannot be attributed to Ti ii since its amplitude is more than twice as large as that of the 3372.80 or 3383.77 Å lines. On the other hand, both amplitudes and half widths fit perfectly if the broad emission component is identified the Fe xiii line; also, the fitted half widths agree very well with the half width determined for the Fe xiii line in the CN Leo time

1 available via http://physics.nist.gov/cgi−bin/AtData/main asd series (see section 6). The central wavelength of the absolute line position is a bit on the blue side but well within the 2- σ error, while the absolute positions of the three single fit Ti ii lines seem to be slightly redshifted (but only to within 1-σ error each). The 3387.84 Å Ti ii line unfortunately has a large error in its central wavelength. Given this situation, we cannot draw any meaningful conclusions about possible wavelength shifts and remark that during a flare line shifts frequently occur due to mass motions.

5.3. GL Vir

The continuum for GL Vir is low as for CN Leo, but unlike CN Leo the Ti ii at 3380 Å line is barely detectable. Nevertheless there is a broad emission line at 3387.81±0.14 Å with a half width of 0.15 Å and an amplitude of 141.7±28.9 counts. If this emission is attributed to the Ti ii line, the measured amplitude would contradict the atomic data, which predicts the same intensity as for the 3380 Å line (which is not seen at all, cf, Fig. 1). If, on the other hand, this feature is identified with the Fe xiii line, it is clearly blue shifted. Since the star is in a quiescent state (as can be seen from the light curve, which is not shown here) it is unlikely that a blue shift is caused by mass motions. However, the blue shift could alternatively be caused by absorption at the red wing of the Fe xiii line due to a Co I line at 3388.17 Å which is also seen in other spectra (see Fig. 1). More evidence for an interpretation involving the Fe xiii line can be gained from the amplitude of the 3383.71 Å line of 65 ± 15 counts. The 3387 Å Ti II line should have a smaller amplitude according to the atomic data and the measured spectra of CN Leo. On the other hand, the half widths of the 3383.71 Å line (0.13±0.02 Å) and of the 3387.81 Å line (0.15 ±0.01) are consistent with each other. The Ti II line at 3372.73 Å is unfortunately too deformed to allow any conclusions on its half width or amplitude. Therefore the question arises whether the half widths of the two lines at 3383.71 Å and 3387.81 Å can be caused by rotation. The rotation velocity v sin(i) for GL Vir was measured by Delfosse et al. (1998) as 9.2 ± 1.9 km s^{−1}, while we determined 15.3 ± 0.8 km s^{−1} (see section 4). Thus, if our rotational velocity is correct, the half widths σ can be explained by rotational broadening, however, if v sin(i) =9.2 km s^{−1}, the measured half width is a somewhat too large to be explained by the rotation. So the data of GL Vir are not unambiguous.

5.4. LHS 2034

The flare star LHS 2034 was observed during a longer flare on March, 14th, lasting over half an hour as can be seen from the light curve of the photometer (not shown here). While only the very strongest chromospheric emission lines can be seen in quiescence, a multitude of emission lines becomes visible in the spectrum taken during flare maximum. Indeed, the flare spectrum of LHS 2034 is very similar to the spectrum of CN Leo with a rather flat continuum without strong absorption lines and dominated by strong chromospheric emission lines. Surprisingly, however, we did not find any evidence for Fe xiii emission in this spectrum. The same analysis procedure

B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars 7

Fig. 2. To the left the light curve of the flux of LHS 2076 on March, 15th, corresponding to a single spectrum. On the x-axis the universal time is given. The flux is in arbitrary units since the photometer is used for engineering purposes. The upper light curve corresponds to the red arm of the spectra, while the lower light curve corresponds to the blue arm and is scaled relative to the red flux for convenience. Two short duration flares can be seen in both the red and the blue arm of the photometer following each other rapidly. To the right the spectrum of LHS 2076 during the flare around 3388 Å showing an broad emission feature at 3387.92 Å.

Table 3. Properties of the Ti ii and the Fe xiii line during the flare on LHS 2076. Given are the amplitude (in electrons), the central wavelength and half width σ of each line for the best fit. For the 3380.28 Å line no error estimation for the half width was possible due to the low signal to noise ratio.

Ti ii (3372.80 Å) Ti ii (3380.28 Å) Ti ii (3383.77 Å) Ti ii (3387.84 Å) Fe xiii (3388.1 Å) amplitude 134.3±19.2 67.3±17.3 115.1±17.3 11.7±16.0 305.5±35.1 central λ 3372.85±0.05 3380.33±0.15 3383.81±0.04 3387.81±1.3 3387.93±0.1 σ 0.06±0.01 0.06 0.05±0.01 0.04±0.01 0.20±0.02

as applied for LHS 2076 was used for the flare spectrum of LHS 2034. All four Ti II lines are found to have about the same FWHM as expected but also the same amplitude contrary to expectation from atomic data and what was found for CN Leo and LHS 2076. This fact remains unexplained. In particular, we cannot attribute – as in LHS 2076 – the excess emission to Fe XIII, since this would contradict the measured FWHM. Obviously, efficient chromospheric heating of LHS 2034 does occur during the flare, but the corona is either not hot enough or too hot for producing a detectable Fe xiii line flux.

5.5. DX Cnc and LHS 292

These two stars and LHS 2034 are the latest-type stars in the sample and have a very low signal to noise ratio (which applies for the quiescent spectrum for LHS 2034 as well) which can cause the non detection of Fe xiii. In order to answer this question we took the spectrum of CN Leo as a template and reduced it to the lower signal to noise ratio found in our DX Cnc and the quiescent LHS 2034 spectra. The results of this exercise for DX Cnc are shown in Fig. 3. Clearly the Ti ii and Fe xiii lines can be recognized in this example. Carrying out a larger number of such simulations we found that the Fe xiii need not always be recognisable, but the Ti ii line should always be found in lower SNR spectra. Thus the level of activity in these stars must be lower making the persistent presence of the Fe xiii line unlikely.

Fig. 3. Spectrum of CN Leo with a signal to noise ratio artificially reduced to that of DX Cnc. But despite the low signal to noise ratio clearly the Ti ii and Fe xiii lines can be recognized.

5.6. UV Cet

UV Cet is a binary flare star well known from the radio to Xray band (Stepanov et al. 1995) and has been resolved in the X-ray for the first time only recently (Audard et al. 2003). Our UVES spectrum was taken with both components in the slit, but we were unable to resolve the spectra of the two stars (due to the seeing). Therefore the spectrum should be dominated by the brighter A-component. The emission lines seen in the spectrum of UV Cet seem to have superimposed a second component of narrow emission lines which are slightly redshifted. We

8 B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars

Fig. 4. The spectrum of UV Cet 3388.1 Å (grey) in comparison to the spectrum of CN Leo (black) broadened artificially to the rotational velocity of UV Cet.

tentatively interpret this second set of emission lines as an active chromospheric region occupying only a part of the stars surface, since it is too narrow to be ascribed to the second component of the binary system.

Searching for the Fe xiii line we compared the broad component of the spectrum of UV Cet with an artificially broadened spectrum of CN Leo (see Fig. 4). The Fe xiii line disappears in the broadened spectrum since it becomes totally blended with the Ti ii line at 3387.84 Å. Therefore a detection of the Fe xiii line in the UV Cet spectrum can only be obtained through indirect reasoning as follows: First, the broadened spectrum of CN Leo fits very well to the UV Cet spectrum in this wavelength region, although - admittedly - in other spectral regions there is less similarity. Second, we know from CN Leo and atomic data that the flux in the Ti ii line at 3387.84 Å should be less than that contained in the 3372.80 Å line, but for UV Cet we find just the opposite. In order to determine line fluxes, we fitted each spectral line simultaneously with a narrow and a broad component (see Table 4). If the broad component comes from the whole surface of the star and the narrow component from an active region, the combined amplitudes must be considered and the combined amplitude of the 3387.84 Å line is higher than the amplitude of the 3372.80 Å line thus providing evidence of additional emission in the lines. The same applies for a comparison with the Ti ii line at 3380.28 Å for which one expects equal flux ratios. If one plots the line ratios for the time series of CN Leo and other stars, one finds, that the UV Cet lines are the only one with a ratio that needs additional flux in the 3387.84 Å line (see Fig. 5). Given the high degree of activity on UV Cet it is suggestive to attribute this additional emission to the Fe xiii line, but given the complicated situation with the narrow and broad set of emission lines we consider the detection of Fe XIII in UV Cet as tentative.

5.7. AD Leo, AT Mic, YZ CMi, and FN Vir

For the other stars in our sample with spectral type M4.5 - M6 the situation is not as clear due to the presence of two absorption lines at 3387.45 (Ni I) and 3388.17 (Co I) Å in the spectrum. This situation applies for the three stars AT Mic, YZ CMi

Fig. 5. Top panel: Logarithm of the line flux (in electrons) of the 3387 Å line plotted versus the logarithm of the line flux of the 3380 Å line for the spectra of the CN Leo time series, LHS 2034, LHS 2076 during the flare, YZ CMi, AD Leo, AT Mic. The straight line marks the ratio of unity. The square marks the flux of LHS 2076 where the line is blended with Fe xiii and the fit cannot disentangle the two lines well. Bottom panel: Logarithm of the combined flux of the 3387 Å and the Fe xiii line plotted versus the 3380 Å line. The triangles denote UV Cet with respect to the combined set of emission lines. Clearly AD Leo, AT Mic, YZ CMi and LHS 2034 show no Fe xiii line emission, while the UV Cet line ratios are in the regime of stars with additional Fe xiii flux (note, that the square denoting LHS 2076 has moved above the line of unity).

and AD Leo: The Ti ii lines at 3372, 3380 and 3383 Å have a width of about 0.05 Å whereas the line at 3387 Å shows a width of 0.1 Å. This can be due to the Fe xiii line blended by the absorption feature at 3388.17 Å, alternatively, leftover continuum may also be an explanation for the broader Ti ii line since the spectra of the three stars do show many absorption lines. In order to test this hypothesis we used the spectrum of the earliest M dwarf GJ 229 as a template for the photospheric part of the spectrum applying the spun up and scaled spectrum as a “background” for the emission line fit with CORA. For the three stars AT Mic, YZ CMi and AD Leo this method yields a best fit with a narrow Ti ii line of about 0.05 Å half width σ, consistent with the half width found for the other Ti ii lines in these stars. The fitted spectra are displayed in Fig. 6. Therefore the apparent width of the 3387 Å line seems to be due to photospheric continuum and there is no need to invoke Fe xiii emission in these three stars.

B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars 9

Table 4. Properties of the Ti ii of UV Cet measured with CORA using a broad and a narrow component simultaneously. Given are always the values for the narrow (first) and the broad component (second).

Ti ii (3372.80 Å) Ti ii (3380.28 Å) Ti ii (3383.77 Å) Ti ii (3387.84 Å) amplitude 380 and 2416 329 and 1394 662 and 4665 520 and 5393 central λ 3372.80 3380.31 3383.82 3387.88 σ 0.04 and 0.23 0.05 and 0.30 0.07 and 0.53 0.05 and 0.46

Fig. 6. The best fit of the 3387 Å line for the stars AD Leo, AT Mic and YZ CMi with the rotational broadened spectra of GJ 229 as background (black line).

For the case of FN Vir this method cannot be used, because the template GJ 229 deviates significantly from the photospheric absorption lines seen in FN Vir. However, since the Ti ii line at 3372 Å is found to have the same half width σ (0.11 ± 0.01 Å) as the 3387 Å line (0.12 ± 0.01 Å), there is again no need to invoke any Fe xiii emission for this star, either.

Fig. 7. Light curve of the flux of CN Leo on March, 16th, during the second observation block but otherwise like in Fig. 2. Clearly a major flare can be seen in both the red and the blue arm of the photometer.

5.8. Proxima Centauri

For Proxima Centauri the Ti ii lines are clearly seen in emission, but again the template GJ 229 deviates significantly if overlaid to the spectrum. In addition to this, the continuum is ill defined and therefore a fit of the line very difficult although especially the Ti ii line at 3387 Å is clearly seen. Although the bump on the red side of the Ti ii line at 3387.84 Å is somewhat suggestive of a Fe xiii emission line blended with the absorption line of Co I, this could also be due to leftover continuum. Since we were not able to obtain meaningful fits, the situation for Proxima Centauri must remain open and we must refrain from drawing any conclusions.

6. Timing behavior of the Fe xiii line in CN Leo

Every night during the observation run in March 2002 (with the exception of March, 14) two series of spectra were taken of CN Leo, each consisting of 3 spectra with 20 minutes exposure. On March, 14th only one spectral series of one hour duration was taken, one single spectrum taken about 2 hours later was combined with the others to only one time series. We averaged the spectra of each series to improve the signal to noise ratio and constructed a total of 7 spectra of CN Leo. During the second spectral series on March, 16th CN Leo a major flare occurred as can be seen in the photometer light curve in Fig. 7; on March, 14th CN Leo was very quiet, showing very little of the flickering seen in the light curves on the other days.

We used the CORA line fitting program to measure the Ti ii lines and the Fe xiii line fluxes as described in section 5.2; a listing of our fit results can be found in Table 5. The Fe xiii line

10 B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars

was detected in all spectra. However, for the spectrum taken on March, 16th during the flare the fit results are ambiguous. One can obtain a good fit with two narrow lines or a narrow and a broad line, where the broad line has nearly the same central wavelength like the narrow line (i. e. the Fe xiii line is blueshifted). We assume that the fit with the lineshift of the Fe xiii line is the correct one, since there is definitely a second line and a physical interpretation with two narrow lines one of which is ascribed to Fe xiii with a halfwidth σ of only 0.1 Å is not meaningful due to temperature broadening. Therefore a fit with two narrow lines implies that there is no Fe xiii present. This can be possible, when the Fe xiii is ionized to higher ionisation stages during the flare. This is quite unlikely though, since we find no Fe xiv emission at 5303 Å in CN Leo (see section 8) even during the flare. Moreover the second emission line has to be explained otherwise. We favour therefore an interpretation with a narrow Ti ii line and a broad blue shifted Fe xiii line. Line shifts are known to occur during flares, when the emitting material is raised in the atmosphere. The velocity towards the observer in the line of sight is about 20 km s^{−1} in this case. A blueshifted Fe xiii line during the flare lines in with the blueshift of the Fe xiii line we observed in LHS 2076 during the flare.

Although the photometer data for the spectra outside the major flare are rather constant, the corona must have undergone some variability as can be seen from Fig. 8, where the averaged spectra of each time series are shown. The Fe xiii line is most clearly seen in the spectrum of the first series taken on March, 15th, where the continuum is relatively high and the Ti ii line is very intense, although in the photometer data no notable flux variability is seen besides the usual flickering. In the other spectra the line does not show that clearly, in fact the line would be undetectable if it were only a bit weaker or if one chose a higher background level. Thus even for CN Leo the Fe xiii line need not to be a persistent feature, and the high variability during quiescence is suggestive of the microflaring as proposed for the heating of stellar coronae (Kashyap et al. 2002). Also the chromospheric Ti ii line shows major variability even on a timescale of hours. For example, on March 13th the amplitude of the Ti ii lines increased by a factor of more than two over a time span of only two hours. Therefore also the chromosphere must have undergone rapid and large changes.

7. X-ray and Fe xiii line fluxes

Using the standard star HD 49798 for flux calibration, we measured absolute fluxes in the Fe xiii 3388.1 line for the stars CN Leo, GL Vir and for LHS 2076 (during the flare). Since the standard star was observed only once per night, we estimate an error in this absolute flux calibration up to a factor of two. Broad band X-ray fluxes for these stars were obtained from broad band count rates and should have (systematic) errors of about 50 %, resulting from the adopted count rate to energy flux conversion. Also note that for none of our stars do we have simultaneous optical and X-ray observations. The measured average fluxes for the one hour duration spectra of CN Leo range from 3.2 · 10^{−15} cm^{−2} s^{−1} in the first spectrum taken on 2002-03-13 to 1.4 · 10^{−14}erg cm^{−2}s^{−1} in the first spectrum on 2002-03-15. For the Fe xiii line flux of GL Vir we computed 3.9 · 10^{−15}erg cm^{−2}s^{−1}, and for the flare spectrum of LHS 2076 the measured flux is 9.8 · 10^{−15}erg cm^{−2}s^{−1}. Using distances of 2.4 pc for CN Leo 6.5 pc for GL Vir and 5.2 pc for LHS 2076 (Oppenheimer et al. 2001) these fluxes result in line luminosities of 2.0 · 10^{24} up to 9.6 · 10^{24}erg s^{−1} for CN Leo, 1.9 · 10^{25}erg s^{−1} for GL Vir and 3.2 · 10^{25}erg s^{−1} for LHS 2076. Comparing these numbers with the non-simultaneously measured X-ray luminosities one then finds a ratio of broad band X-ray to line luminosity in the range 3012 to 628 for CN Leo, 235 for GL Vir and of 124 for LHS 2076.

If one takes CN Leo as a prototype showing Fe xiii emission the ratios of GL Vir and LHS 2076 are too low. However, for LHS 2076 the Fe xiii was measured during a flare, while the X-ray luminosity was measured during quiescence and is therefore presumably too low leading to an incorrect (lower) ratio. In the case of GL Vir the line was measured during quiescence and the low ratio adds therefore to the interpretation, that the line is actually the Ti ii line broadened by the higher rotation rate we found for GL Vir.

8. Search for other forbidden coronal lines in CN Leo

After the detection of the Fe xiii line in CN Leo the question arises if there is evidence for other forbidden coronal lines. A catalog of such lines can be found e. g. in Allen (1973). Out of this we investigated the following two lines more closely: Ca xii at 3327 Å and Fe xiv at 5303 Å.

Using the CHIANTI software package (Young et al. 2003) we computed emissivity ratios for the lines mentioned above to the Fe xiii line, which are proportional to the flux ratios of the lines. All computations were done assuming solar photospheric abundances since we do not know anything specific about the coronal abundances of very low mass stars. The ionisation balance was computed using the ionisation ratios found by Mazzotta et al. (1998). The computed flux ratios proved to be quite sensitive on the ionisation balance whose choice can influence the computed flux ratios by more than a factor of two while the chosen abundances have less influence.

8.1. Analysis of the Ca xii line

A plot of the region around the Ca xii line is shown in Fig. 9. Besides the two Ti ii lines the other faint emission features are unidentified, but none of them is likely to be caused by Ca xii because the line width is too narrow for a line formed at temperatures of about log T∼ 6 for which one would expect a halfwidth of 0.2 Å. While a line consisting of 50 counts and a halfwidth of 0.2 Å can easily be hidden in the spectrum a line with 100 counts should be possible to detect. This leads to restrictions for the possible temperatures and densities. Since we measured 200 counts in the Fe xiii line at 3388 Å for CN Leo averaging all our spectra, the highest possible ratio between the two lines that is in agreement with a non-detection is about 0.5, which excludes temperatures higher than log T=6.4 and lower than log T=6.0. A more detailed discussion is given in the next subsection together with the restrictions drawn from Fe xiv.

B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars 11

Table 5. List of the line fluxes, central wavelength and half widths σ measured with CORA. Due to the signal to noise ratio the computation of the error of the half width could not be done for every line.

spectral block Ti ii (3372.80 Å) Ti ii (3380.28 Å) Ti ii (3383.77 Å) Ti ii (3387.84 Å) Fe xiii (3388.1 Å) 2002-03-13 1st 137.7±16.3 31.5±9.6 83.2±12.8 33.1±10.4 115.6±26.3 3372.77±0.05 3380.27±0.04 3383.74±0.04 3387.82±0.02 3387.88±0.17 0.06±0.01 0.03±0.01 0.04±0.01 0.02±0.01 0.20 2002-03-13 2nd 290.1±21.6 132.2±16.0 215.4±18.8 197.8±21.6 201.0±33.0 3372.78±0.04 3380.25±0.04 3383.73±0.03 3387.83±0.03 3388.02±0.09 0.06±0.01 0.05±0.01 0.04±0.01 0.05±0.01 0.21 2002-03-14 161.5±15.9 61.4±12.6 122.9±14.7 81.6±16.2 148.8±26.0 3372.78±0.03 3380.27±0.05 3383.73±0.04 3387.84±0.05 3388.09±0.26 0.04±0.01 0.05±0.01 0.04±0.01 0.05 0.30 2002-03-15 1st 576.4±29.1 295.7±23.4 490.6±27.1 302.2±28.1 535.1±51.2 3372.79±0.03 3380.27±0.03 3383.75±0.03 3387.83±0.03 3388.02±0.09 0.04±0.01 0.04±0.01 0.04±0.01 0.04±0.01 0.26±0.02 2002-03-15 2nd 437.7±24.8 179.6±18.1 315.0±21.8 164.5±20.1 265.7±39.0 3372.80±0.03 3380.27±0.03 3383.76±0.03 3387.82±0.04 3388.19±0.17 0.04±0.01 0.04±0.01 0.04±0.01 0.05±0.01 0.30 2002-03-16 1st 205.6±19.3 68.1±12.5 122.8±14.8 57.2±14.3 307.6±34.5 3372.80±0.05 3380.26±0.03 3383.75±0.03 3387.85±0.03 3387.98±0.17 0.06±0.01 0.03±0.01 0.04±0.01 0.03±0.01 0.24±0.02 2002-03-16 2nd 125.5±15.3 25.6±8.9 65.5±10.8 26.6±11.0 134.8±26.6 3372.82±0.05 3380.28±0.04 3383.76±0.03 3387.84±0.03 3387.88±0.14 0.06±0.01 0.03±0.01 0.02±0.01 0.02±0.01 0.20

Fig. 9. The spectrum of CN Leo around the Ca xii line. Two Ti ii lines are identified; the other faint emission features are unidentified.

8.2. Analysis of the Fe xiv line

We carefully searched for the Fe xiv line at 5303 Å. Since the line could be hidden in the molecular lines dominating this wavelength region we compared the CN Leo spectra to each other and to the LHS 2034 averaged spectrum, assuming that this star does not display the Fe xiv line. But no significant difference could be found. Therefore we conclude, that no Fe xiv emission can be seen in CN Leo.

Out of the absence of the Fe xiv and the Ca xii emission lines the possible temperatures and densities can be estimated. To be in agreement with a non-detection for the Ca xii line the flux ratio must be lower than about 0.5 and for the Fe xiii lower than about 5.5. In Fig.10 a contour plot of the ratio between the Ca xii and the Fe xiii and the Fe xiv and the Fe xiii

Fig. 10. Contour plot of the flux ratios between the Ca xii and the Fe xiii line (black) for a set of temperatures and electron densities and for the ratios of the Fe xiv and the Fe xiii line (grey). The inner line represents a ratio of 0.4, the middle line a ratio of 0.5 and the outer line a ratio of 0.6 for Ca xii and for Fe xiv the inner line represents a ratio of 5.0, the middle line a ratio of 5.5 and the outer line a ratio of 6.0. The shaded area denotes the parameter set that is in agreement with the nondetection of Ca xii and Fe xiv.

line is given. From this plot one can exclude temperature lower than log T=6.0 and higher than log T=6.2 for low densities, log T=6.3 for higher densities and log T=6.4 for very high densities. Therefore the line formation of the Fe xiii line takes place around the peak formation temperature of log T=6.2 – what would be expected from the beginning. For the densities the plot is not very restrictive. Even densities as high as N_e = 10^{12}cm^{−3} can be possible if the temperature is close enough to the peak formation temperature.

12 B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars

9. Discussion and conclusions

Our study reveals high and rapid variability of the Fe xiii line on the two stars CN Leo and LHS 2076. While the former seems to have coronal temperatures high enough even in its quiescent state to show the Fe xiii line, the latter does not. Major flares were observed on both stars with opposite behavior: In LHS 2076 we observed the Fe xiii line during the flare, while in the flare spectrum of CN Leo the line becomes undetectable. This can be most easily explained as a temperature effect: In its quiescent state the corona of LHS 2076 is too cool to produce a sufficiently strong Fe xiii line, but is heated to sufficient temperatures during the flare. On the other hand, the corona of CN Leo is hot enough for production the Fe xiii line during quiescence, and is heated to even higher temperatures during flares, causing a shift of the ionization of Fe xiii to higher ionization stages, and therefore Fe xiii becomes undetectable.

In addition to these two absolutely secure detections GL Vir and UV Cet may exhibit the Fe xiii line, too. For Prox Cen the situation is unclear. In the stars AD Leo, AT Mic, YZ CMi and FN Vir no Fe xiii line could be found. In the stars DX Cnc, LHS 292 and the quiescent LHS 2076 no Fe xiii line could be found as well. That may be due to the low signal to noise ratio but simulation strongly suggest that these stars are not active enough to show the Fe xiii line. Rather surprisingly no Fe xiii line could be found in the flaring LHS 2034, either. So there are at most four detections of Fe xiii in a sample of 16 or 13 stars, respectively if one does not count the two double stars LHS 428 and LHS 6158 and the template GJ 229A. This might seem not very much at first glance since all are very active stars. However, one of the the goals of the project was to observe a wide range of spectral types to determine for which stars a detection of Fe xiii is feasible at all. And if the case of LHS 2076 applies to the other stars as well and the corona is only hot enough to show the Fe xiii line during major flares we would only expect one more detection, since LHS 2034 showed a flare, too. But in contrast to the two flares on CN Leo and LHS 2076 this was a long duration flare, whose decays lasted longer than half an hour and we would expect different behavior of the spectral lines in the course of such a different type of flare.

Moreover the Fe xiii line may have been detected for some of the stars with a better signal to noise ratio. This can be estimated for AD Leo where from EUVE observations a flux at Earth of 2.69 · 10^{−4}photons cm^{−2}s^{−1} has been measured for the 203.83 Å line of Fe xiii (Sanz-Forcada & Micela 2002). Using atomic data from the CHIANTI database (Young et al. 2003), we compute a flux ratio of the two lines of^{F3388}_{F203} = 0.02 . . . 0.05 assuming coronal densities in the range of 10^8 up to 10^{10}cm^{−3} and temperatures in the range of 1 up to 2 10^6 K. This translates into a line flux of 5.210^{−16} · · · 1.310^{−15}erg cm^{−2}s^{−1} in the Fe xiii line at 3388 Å, which in turn would correspond to an amplitude of at most 26 counts in this line (for a 0.3 hr integration, which is the typical exposure time for all of our spectra); clearly, such flux levels can easily be hidden in the spectrum. If the Fe xiii line at 203.83 Å is blended with other iron lines the expected amplitude would be even less. Therefore data with much better signal to noise are required to settle this question.

CN Leo is unique in the sample when it comes to clear exhibition of the Fe xiii line in quiescent state, which we ascribe to a high level of microflaring, since the coronal line is quite variable. This variability of the corona while the photospheric flux measured with the photometer is quite constant calls for a parallel observation in X-rays with Chandra or XMM-Newton, since the coronal variability should lead to X-ray variability. This high level of variability in the basic coronal emission is surprising, but it finds it counterpart in the high level of chromospheric emission in the hydrogen emission lines of the Balmer series which are clearly seen up to H_{24}. This is in contrast to the Sun where even in flares the Balmer lines are only excited up to H_{16} (Švestka 1972).

Though the variability of Fe lines for the Sun was studied extensively in X-ray wavelengths by the satellites SOHO and TRACE the variability of the emission in Fe xiii lines was not studied to our knowledge, yet. However for the forbidden optical green Fe xiv line at 5303 Å there are measurements by the SOHO instrument LASCO (Large Angle Spectrometric Coronagraph) (Wood et al. 1998). Observing quiescent coronal limb structures Wood et al. found statistically significant quasi-steady brightening on timescales of at least an hour. This is about the same timescale on which we observed the fading of the Fe xiii line in CN Leo on March, 15th from a very pronounced to a barely detectable line profile, which took less than three hours.

Acknowledgements. We thank Dr. Jan-Uwe Ness supplying to us his CORA line fitting program and providing technical support.

References

Allen, C. W. 1973, University of London (The Athlone Press) Audard, M., Güdel, M., & Skinner, S. L. 2003, ApJ, 589, 983 Berger, E. 2002, ApJ, 572, 503 Delfosse, X., Forveille, T., Perrier, C., & Mayor, M. 1998, A&A, 331, 581 Flower, D. R. & Pineau des Forets, G. 1973, A&A, 24, 181 Güdel, M. 2002, ARA&A, 40, 217 Hünsch, M., Schmitt, J. H. M. M., Sterzik, M. F., & Voges, W.

1999, A&AS, 135, 319 Kashyap, V. L., Drake, J. J., Güdel, M., & Audard, M. 2002, ApJ, 580, 1118 Mazzotta, P., Mazzitelli, G., Colafrancesco, S., & Vittorio, N.

1998, AASS, 133, 403 Mohanty, S. & Basri, G. 2003, ApJ, 583, 451 Ness, J.-U. & Wichmann, R. 2002, Astronomische Nachrichten, 323, 129 Oppenheimer, B. R., Golimowski, D. A., Kulkarni, S. R., et al.

2001, AJ, 121, 2189 Pettersen, B. R. 1985, A&A, 148, 151 Sanz-Forcada, J. & Micela, G. 2002, A&A, 394, 653 Schmitt, J. H. M. M. 1997, A&A, 318, 215 Schmitt, J. H. M. M., Fleming, T. A., & Giampapa, M. S. 1995, ApJ, 450, 392 Schmitt, J. H. M. M. & Liefke, C. 2002, A&A, 382, L9 Schmitt, J. H. M. M. & Wichmann, R. 2001, Nature, 412, 508 Stepanov, A. V., Fuerst, E., Krueger, A., et al. 1995, A&A, 299, 739

B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars 13

Švestka, Z. 1972, ARA&A, 10, 1 Wood, B. E., Karovska, M., Cook, J. W., et al. 1998, ApJ, 505, 432 Young, P. R., Del Zanna, G., Landi, E., et al. 2003, ApJS, 144, 135

14 B. Fuhrmeister, J. H. M. M. Schmitt and R. Wichmann: Fe XIII in cool M stars

Fig. 8. Best fit of the Ti ii line together with the Fe xiii line in the averaged spectral series. At the top the two spectra taken on March, 13th (left: start time 2.3 UT right: start time 4.2 UT), beneath the two spectra taken on March, 15th (left: start time 3.7 UT, right: start time 6.4 UT), beneath the spectra taken on March, 16th (left: start time 3.9 UT, right: start time 5.9 UT). The single spectrum at the bottom was taken on March, 14th (start time 3.1 UT). The horizontal line in each spectrum indicates the background used for the line fitting.