arXiv:astro-ph/0306043v1 2 Jun 2003

STIS spectroscopy of the emission line gas in the nuclei of nearby FR-I galaxies^1

Jacob Noel-Storr^{2,3}, Stefi A. Baum^3, Gijs Verdoes Kleijn^4, Roeland P. van der Marel^3, Christopher P. O’Dea^3, P. Tim de Zeeuw^5, and C. Marcella Carollo^6

ABSTRACT

We present the results of the analysis of a set of medium resolution spectra, obtained by the Space Telescope Imaging Spectrograph on board the Hubble Space Telescope, of the emission line gas present in the nuclei of a complete sample of 21 nearby, early-type galaxies with radio jets (the UGC FR-I Sample). For each galaxy nucleus we present spectroscopic data in the region of Hα and the dervived kinematics.

We find that in 67% of the nuclei the gas appears to be rotating and, with one exception, the cases where rotation is not seen are either face on or have complex central morphologies. We find that in 62% of the nuclei the fit to the central spectrum is improved by the inclusion of a broad component. The broad components have a mean velocity dispersion of 1349 ± 345 km s^{−1} and are redshifted from the narrow line components (assuming an origin in Hα) by 486 ± 443 km s^{−1}.

Subject headings: galaxies: active — galaxies: elliptical and lenticular — galaxies: individual (NGC 193, NGC 315, NGC 383, NGC 541, NGC 741, UGC 1841, NGC 2329, NGC 2892, NGC 3801, NGC 3862, UGC 7115, NGC 4261, NGC 4335, M84, M87, NGC 5127, NGC 5141, NGC 5490, NGC 7052, UGC 12064, NGC 7626) — galaxies: kinematics and dynamics — galaxies: nuclei

1Based on observations with the NASA/ESA Hubble Space Telescope, obtained at the Space Telescope Science Institute, which is operated by the Association of Universities for Research in Astronomy, Inc., under NASA contract NAS 5-26555

2Columbia University, Astronomy Department, New York, NY 10027 jake@astro.columbia.edu

3Space Telescope Science Institute, 3700 San Martin Drive, Baltimore, MD 21218

4European Southern Observatory, Karl-Schwarzschild Str. 2, D-85748 Garching, Germany

5Sterrewacht Leiden, Postbus 9513, 2300 RA Leiden, The Netherlands

6Institute of Astronomy, ETH Zentrum, CH-8092 Zurich, Switzerland

– 2 –

1. Introduction

A nearby radio galaxy can produce a radio jet that reaches up to ∼ 1 Mpc, emerging from a central engine that resides in an active region ∼ 10^{−3} pc in radius in its nucleus. The energy that powers radio jets and active nuclei is typically believed to be produced by the accretion of material onto a central supermassive black hole (Rees 1984). Central emission line gas is detected in virtually all nearby radio galaxies that harbor kiloparsec-scale radio jets, and this gas along with nuclear dust presumably provide sources of fuel for the central black hole. However, the relationship between normal early-type galaxies and early-type galaxies that are radio-loud remains one of the mysteries in active galaxy research.

Current evidence suggests that all galaxies may have central black holes and that the size of the black hole is a strong function of the mass of the bulge (for example, Kormendy & Richstone 1995) and and even stronger function of the central stellar velocity dispersion (Ferrarese & Merritt 2000; Gebhardt, et al. 2000; Merritt & Ferrarese 2001; Tremaine, et al. 2002). It is not clear what drives these relationships or whether they are the same for active and quiescent galaxies. Since black hole growth and nuclear activity are causally related, scatter in these relationship can, in principle, put limits on the frequency and duration of nuclear activity in galaxies.

Typical findings are that 60% of quiescent early-type galaxies have detections of emission line gas (e.g. Philips, et al. 1986; Goudfrooij, et al. 1994) and about 40% have nuclear dust (e.g. van Dokkum & Franx 1995; Tran, et al. 2001). Despite the apparent presence of fuel, these galaxies fail to produce radio jets or any significant nuclear activity.

Nearby early-type galaxies with radio jets provide an opportunity to gain an understanding of the conditions in a galaxy which lead to the formation of a radio-active nucleus and of the physics of the regions which harbor the black hole and jet formation regimes. To this end, we are undertaking a coordinated, multiwavelength, study of a complete sample of the nearest radio galaxies (see §2).

Based on our imaging with the Hubble Space Telescope (HST) Wide Field and Planetary Camera - 2 (WFPC2) we found that the galaxies of our sample show ubiquitous nuclear dust and emission line gas (Verdoes Kleijn, et al. 1999). An understanding of the gas kinematics in the central region can enable us to determine the black hole masses (Harms, et al. 1994; Ferrarese, Ford, & Jaffe 1996; Machetto, et al. 1997; van der Marel & van den Bosch 1998; Ferrarese & Ford 1999; Verdoes Kleijn, et al. 2000; Sarzi, et al. 2001; Barth, et al. 2001) and the ionization mechanisms at work in the nuclear regions (e.g. Dopita, et al. 1997) and relate these to other properties of the activity and of the galaxy as a whole. In order to achieve this goal we have obtained HST Space Telescope Imaging Spectrograph (STIS) medium

– 3 –

resolution long slit spectra of the nuclear regions of our sample galaxies. We present those data here. In future work we will go on to model the kinematics and other properties of the emission line gas.

The paper is organized as follows. In section 2 we describe the sample and in section 3 we describe the STIS spectroscopic observations and the data reduction. In section 4 we describe our analysis procedures. We present our initial interpretations in section 5 and draw conclusions in section 6. We use a Hubble constant of H_0 = 50km s^{−1} Mpc^{−1} throughout.

2. Sample selection and Properties

Our galaxy sample (the UGC FR-I sample) contains all 21 nearby (v_r < 7000 km s^{−1}), elliptical or S0 galaxies in the declination range −5^∘ < δ < 70^∘ in the UGC catalog (Nilson 1973, limits magnitude m_B < 14.^m6 and angular size θ_p > 1.^′0) that are extended radio-loud sources (larger than 10^{′′} at 3σ on VLA A-Array maps and brighter than 150 mJy from single dish flux density measurements at 1400 MHz)^7. The source information is shown in Table 1.

This complete sample was drawn from a catalog of 176 radio-loud galaxies constructed by Condon & Broderick (1988), by position coincidence of radio identifications in the Green Bank 1400 MHz sky maps and galaxies in the UGC catalog.

All of the galaxies fall into the Fanaroff & Riley (1974) Type-I (FR-I) radio classification (see Xu, et al. 2000, for a description of the radio properties of our sample); i.e. they are low luminosity radio galaxies, with jets that are brightest nearest to the nucleus. (In contrast, FR-II galaxies are more powerful radio sources, and have bright spots at the far edges of their radio lobes.)

The primary energy source of each galaxy in the sample falls into ‘monster’ rather than ‘starburst’ classification of Condon & Broderick (1988) based on their infra-red to radio flux ratios (for example, see Heckman, et al. 1983)

u ≡ log ( S_{60μm} S_{1400MHz} ) ≪ 1.6, (1)

and infra-red spectral gradients

7We have slightly adjusted the sample definition since our earlier work, however the galaxies that the sample contains remain the same. The sample is complete within the definition given here as of the time of writing according to up to date data drawn from the NED database.

– 4 –

α_{IR} ≡ log (S_{60μm}/S_{25μm}) log (60/25)

< +1.25. (2)

A photometric analysis of the nuclei of these galaxies was performed by Verdoes Kleijn, et al. (1999), based on observations made using the WFPC2 instrument (using the F555W and F814W filters) on board the HST (the photometric analyses of UGC 7115 and UGC 12064 are presented in Appendix A of Verdoes Kleijn, et al. 2002).

3. STIS Observations

In program 8236 we used HST/STIS (see Kimble, et al. 1998) to take spectra of the 19 sample members not previously or concurrently observed by others. Observations were carried out at both medium (for 19/19 galaxies) and low (for 4/19 galaxies) resolution, with the G750M and the G430L and G750L gratings respectively. Our medium resolution observation log is shown in Table 2. We will present the low resolution spectra in a future paper. We include in our analysis similar medium resolution data obtained by R. Green and collaborators for the nucleus of M84 (program 7124, see Bower, et al. 1998) and H. Ford and collaborators for the nucleus of M87 (program 8666) to complete the data set for UGC FR-I galaxies.

In our program, we observed each galaxy in three parallel, adjacent slit positions. For each slit position we obtained two exposures with a shift of 0.^{′′}202800 (4 unbinned STIS Pixels) along the slit direction to enable us to more efficiently remove detector effects (bad pixels, etc.). In the case of UGC 7115 we observed in only one slit position - we sacrificed STIS observing time to make WFPC2 observations of this galaxy as it had not been included in our earlier WFPC2 program.

The data for M87 (NGC 4486) were obtained in a similar manner to our own. In the case of M84 (NGC 4374) the observation pairs were not shifted along the slit direction, thus some detector effects may remain, though will be much less significant thanks to the far greater signal to noise.

We list the instrumental properties of the STIS configurations used in Table 3. Panel (a) of Figures 2 to 22 (see key in Figure 1) shows the location of the STIS slits on each galaxy observed, along with the position angles of the galaxy major axes and radio-jet axes. For the majority of cases the STIS slits were aligned within 10^∘ of the galaxy major axes (Table 4), with the exceptions that we note below.

In the cases of NGC 741 [ΔP A(galaxy, ST IS) = 19.4^∘] and NGC 2892 [ΔP A(galaxy, ST IS) =

– 5 –

22^∘] more freedom in orientation was allowed to provide reasonable observing windows.

In NGC 3862 and UGC 7115 the position angles of the galaxy major axes are hard to determine, we decided to position the slits approximately perpendicular to the radio jets [ΔP A(radio, ST IS) = 92.3^∘ & 110.4^∘, respectively]. The central major axis is also hard to determine in NGC 541, where the central isophotes rotate considerably. In this case we chose to use a slit position somewhere around the mean of the isophotal position angles with considerable leeway given to allow for reasonable observing windows.

For UGC 12064 the slits were aligned along the major axis of the prominent dust disk, which is offset from the galaxy major axis by ∼ 50^∘.

The slits in M84 were positioned approximately perpendicular to the radio jet, which lies close to the major axis of the nuclear gas. For NGC 4486 (M87) the slits were positioned to follow certain morphological structures across the nuclear regions.

3.1. Data Reduction

We used the standard STIS calibration pipeline (calstis, see Brown, et al. 2002) to perform bias, dark and flat-field corrections using the best available reference files. We used

calstis version 2.13 (26-April-2002) throughout the data reduction^8.

We shifted the rows of alternating observations by 4 pixels, so that they were properly aligned with their counterparts and combined them using the STSDAS routine ocrreject. We cleaned co-incident cosmic rays and negative bad pixels, which would not be caught by

ocrreject, using the NOAO/IRAF task cosmicrays. At each step we carefully investigated

the effects of varying task parameters to insure we were not damaging valid data while removing most cosmic rays.

We made use of the STIS calibration pipeline tasks wavecal and x2d to perform wavelength calibration and image rectification respectively. The error introduced by rectifying after shifting one of the images is ≲ 0.05 pixels (which is ≲ 1.3 km s^{−1} at 6750Å).

Panel (b) of Figures 2 to 22 (see key in Figure 1) shows (i) the central strip of the reduced spectrum for each slit position observed on each galaxy, along with (ii) Gaussian line fits to the same (see §4.1).

8We found that significant variations in measured parameters could be introduced by using different

calstis versions. Versions 2.4 and 2.13 produce consistent results, while intermediate versions do not.

– 6 –

4. Analysis

In this section we describe the line fitting that we carried out on each spectral row of each reduced CCD spectral image, firstly with a single Gaussian per spectral line (§4.1) and secondly with the inclusion of an additional free component (§4.2). In §4.3 we discuss the sizes of the errors on quoted parameters from various sources. In §4.4 we describe each of the UGC FR-I sample members in turn. For each galaxy we define the central spectrum as the row with the greatest integrated flux after the data reduction. We list the row numbers in the final x2d image corresponding to the central spectrum in Table 2.

4.1. Single Gaussian line fitting

In the G750M spectra we expect to find the emission lines in the vicinity of Hα that are listed in Table 5. We used wavelengths from the recent measurements of Wallerstein, et al. (2001) and converted from air to vacuum wavelengths using the IAU standard formula

λ_{vac} − λ_{air} λ_{air}

= 6.4328 × 10^{−5} +

2.94981 × 10^{−2} 146 − (10^4/λ_{air})^2 + 2.5540 × 10^{−4} 41 − (10^4/λ_{air})^2

. (3)

Using one Gaussian to represent each of these five lines we obtain a set of 7 free parameters to fit: the continuum flux level, velocity (v_r), velocity dispersion (σ), and the fluxes of each line. The flux of [N II]_{6550} was fixed in a ratio of 1:3 with the flux of [N II]_{6585} based on the transition probabilities derived from atomic physics (Osterbrock 1989).

We used a χ^2 minimization routine (using Levenberg-Marquardt iterations, see Press, et al. 1992) to fit the Gaussian template to the observed spectra. The application of this fitting technique and development of this routine are described by van der Marel & van den Bosch (1998). Formal errors are drawn from the covariance matrix of the fit. As we do not expect the noise in each spectrum to be normally-distributed after the steps of wavelength calibration and two-dimensional rectification, these error values should be treated strictly as the formal fit errors under the understanding that the size of the real errors may be somewhat different (see §4.3 below).

From this point on we only consider data points where the formal errors from the fits meet the following criteria, allowing us to exclude unreliable data points originating from poorly constrained fits:

Δσ < 50 km s^{−1} (4)

– 7 – ΔF (Hα) F (Hα) < 0.75 (5)

where Δσ and ΔF (Hα) are the errors in velocity dispersion and line flux respectively. The main constraint arises from the limit on the velocity dispersion error. The very large flux error allowed is in place to remove only the few remaining bad data points where the profile very precisely fits the noise.

In Panel (e) of Figures 2 to 22 (see key in Figure 1) we show profiles of (i) radial velocity, (ii) velocity dispersion, (iii) [N II]_{6585} line flux and (iv) [N II] / Hα ratios resulting from this fitting procedure for each of our sample galaxies. These profiles are combined and visualized in 2D for each galaxy in Panel (c) of Figures 2 to 22.

We present the fit data in Tables 6 to 26, where the errors given are the formal errors from the fit. In these tables Column (1) is the row number of the portion of the spectrum fitted. Column (2) shows the offset along the slit direction in arcseconds from the row with the greatest integrated flux. Columns (3) and (4) give the radial velocities (v_r) and gas velocity dispersions (σ_{gas}) respectively. Column (5) gives the line flux of the Hα line and columns (6) and (7) show its ratio against the fluxes of the [N II]_{6585} and [S II]_{total} (the total flux of the two [S II] lines) respectively. Column (8) gives the reduced χ^2 (R^2) value of the resulting fit.

We repeated the fit for the central row of the galaxy NGC 4335 varying the set of free parameters in order to estimate the reliability of the fits that we had used. We found that the fit was stable to within one formal error on all quoted parameters when the velocities, velocity dispersions and fluxes of all parameters were fit independently. The signal to noise falls off rapidly outside of the very nuclear regions so it is not possible to consistently run fits with a large number of free parameters. The results for the nucleus of NGC 4335 satisfy us that we are justified in fixing the parameters in the manner that we have chosen, without adding any obvious biases to our results.

4.2. Fits with an additional free component

In many cases, as the very central pixels are reached the fit begins to do a poorer job of matching the observed profile. In an attempt to improve the fit to the narrow centers of the lines we tested a fit for the central spectrum of each galaxy including an additional fit component with independent velocity, velocity dispersion and flux, along with the original set of five Gaussians. The fits to the central spectra are shown in Panel (d) of Figures 2 to 22 (see key in Figure 1), (i) excluding and (ii) including the additional component.

– 8 –

We assessed the effectiveness of including this component in each galaxy based on (1) an improvement in the mean of the absolute value of the residuals from the fit ≥ 5% (2) an improvement in the reduced χ^2 value of the fit such that (R^2_1 − R^2)/R^2_1 ≥ 0.15 and (3) an improvement judged by eye in the fit compared to the data. We assigned a score to each galaxy, with one point available for each of the three categories. We consider scores of 2 or 3 to be indicative of the presence of a broad component, a score of 1 indicates the possibility of a broad component, while we treat a score of 0 as a none detection. The three parameters and scores are listed in Table 28.

We find an additional free component improves the fit in 62% (N = 13) of the sample galaxies. In the cases of NGC 2329 and NGC 3862 the component appears to represent a non-flat continuum. The kinematic parameters for each galaxy including the additional free component are listed in Table 29 and the flux parameters in Table 30. We present further interpretation of the nature and origin of the features fit by the additional free component in §5.3.

4.3. Quantifying error sources

The STIS data handbook (Brown, et al. 2002) gives the following absolute and relative accuracies applicable to this work: A wavelength absolute calibration error (Δλ offset) of 0.1 to 0.3 pixels (2.6 to 7.7 km s^{−1} at 6500Å) within an exposure, and from 0.2 to 0.5 pixels (5.1 to 12.8 km s^{−1} at 6500Å) between exposures. An absolute photometry error of 5% and a relative photometry error of 2% within a single exposure assuming a wide slit observation. 5 μm variations in slit width along the slit lengths could result in variations of up to 20% in flux along the 0.^{′′}1 slit.

In Verdoes Kleijn, et al. (2002) Hα + [N II] fluxes were presented for each nucleus in the sample. The values presented there agree well with the values we find here, certainly given our limited ability to extract comparable apertures and within the 20% potential flux errors noted above.

In Section 1 we indicated that a 1.3 km s^{−1} error could be incorporated into the final data as a result of shifting the spectra for image combination and cosmic ray rejection. This shift is insignificant compared to other error sources.

In Table 27 we showed that by allowing different free parameters within the single- Gaussian-per-line fit produced changes in the measurement in velocity of ∼ 8 km s^{−1} and of ∼ 16 km s^{−1} in velocity dispersion for the nucleus of NGC 4335.

– 9 –

In Table 33 we show the effect on the measured velocities and velocity dispersions of the various components for each of the models described in the previous section, again for the case of NGC 4335. This illustrates that the measured velocities of the narrow lines may vary by up to ∼ 20 km s^{−1} (and velocity dispersions by as much as ∼ 110 km s^{−1}) when additional components in the line shape are taken into account.

In the nuclei of NGC 383 and NGC 4335 (representing cases with blended and less blended lines respectively) we repeated the narrow line fit to the central spectrum with 286 different combinations of input velocity and velocity dispersion; varying the velocities over a range of 2000 km s^{−1} and the velocity dispersions over a range of 6000 km s^{−1}. In the case of NGC 4335 we found that the velocity varied by ±10.91 km s^{−1} and the velocity dispersion by just ±0.02 km s^{−1}. In the case of NGC 383 we found that the velocity varied by ±13.04 km s^{−1} and the velocity dispersion by just ±3.76 km s^{−1}. There was a systematic effect relating input and output velocities in both cases.

We conclude that reasonable estimates of the genuine errors on each of our measured parameters are: 5% - 10% on fluxes (dominated by the effects of variations along the narrow slits and the STIS absolute calibration); and ∼ 20 km s^{−1} on velocities and velocity dispersions (dominated by the fit model dependency of the results).

4.4. Individual source descriptions

Below, we give descriptions of each member of the UGC FR-I sample in turn. The galaxy classifications are taken from the NASA Extragalactic Database, which lists references in which the terms used are described. Descriptions of dust properties and radio sources are as presented by Verdoes Kleijn, et al. (1999) and Xu, et al. (2000) respectively.

NGC 193 (UGC 408) This S0 galaxy has a complex gas morphology with two lanes apparent in the central regions (the most clearly defined lane has a width : length = 0.18). It has a core-jet radio morphology on VLA and VLBA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 6; the gas does not exhibit a regular rotation curve, though it does appear dominated by systematic rather than random motions. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 2 (see key in Figure 1 for an explanation of these plots).

– 10 –

NGC 315 (UGC 597) This elliptical galaxy has a nuclear dust disk (b/a = 0.23). It has a core-jet radio morphology on VLA and VLBA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 7; the gas appears to be in organized motion, possibly regular rotation. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 3 (see key in Figure 1 for an explanation of these plots).

NGC 383 (UGC 689) This S0 galaxy has a nuclear dust disk (b/a = 0.77). It has a core-jet radio morphology on VLBA scales, and a twin-jet morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 8; the gas exhibits a regular rotation profile. In the negative offset side slit there is a dip in the velocity dispersion profile at a position close to the nucleus. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 4 (see key in Figure 1 for an explanation of these plots).

NGC 541 (UGC 1004) This cD S0 galaxy has a nuclear dust disk (b/a = 0.91). It has a radio core on VLBA scales and a core-jet morphology on VLA scales. The STIS slits were aligned to a mean of the position angles of the central isophotes measured from our WFPC/2 images, which vary considerably. We allowed considerable flexibility in position angle to enable reasonable observing windows. The central kinematic and flux properties are listed in Table 9; the gas does not exhibit a regular rotation profile. The fit to the central spectrum is not significantly improved by the addition of a broad component, though the fit improves somewhat when judged by eye. Data for this galaxy are shown in Figure 5 (see key in Figure 1 for an explanation of these plots).

NGC 741 (UGC 1413) This E0 galaxy has no apparent nuclear dust. It has a radio core on VLBA scales and a core-jet morphology on VLA scales. The STIS slits were aligned approximately parallel to the galaxy major axis, however a certain degree of freedom was allowed in slit placement to allow reasonable observing windows. The central kinematic and flux properties are listed in Table 10. Very few points had sufficient signal to noise to obtain good fits in these data, it has not been included in further analysis of global kinematic properties. The fit to the central spectrum is not improved by the addition of a broad component. Data for this galaxy are shown in Figure 6 (see key in Figure 1 for an explanation of these plots).

– 11 –

UGC 1841 This elliptical galaxy has a nuclear dust disk (b/a ∼ 0.98). It has a core-jet radio morphology on VLBA and VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 11; the gas does not exhibit a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 7 (see key in Figure 1 for an explanation of these plots).

NGC 2329 (UGC 3695) This S0 galaxy has a nuclear dust disk (b/a = 0.68). It has a core-jet radio morphology on VLBA and VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 12; the gas does not exhibit a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component which appears to represent a non-flat continuum in this case. Data for this galaxy are shown in Figure 8 (see key in Figure 1 for an explanation of these plots).

NGC 2892 (UGC 5073) This elliptical galaxy has no apparent nuclear dust. It has a radio core on VLBA scales and a twin-jet morphology on VLA scales. The STIS slits were aligned approximately parallel to the galaxy major axis, however a certain degree of freedom was allowed in slit placement to allow reasonable observing windows. The central kinematic and flux properties are listed in Table 13; the gas does not exhibit a regular rotation profile. The fit to the central spectrum is not significantly improved by the addition of a broad component. Data for this galaxy are shown in Figure 9 (see key in Figure 1 for an explanation of these plots).

NGC 3801 (UGC 6635) This S0/a galaxy has a complex nuclear dust morphology with a large scale dust lane (width : length = 0.12). It has a twin-jet radio morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 14; the gas does not exhibit a regular rotation profile. The fit to the central spectrum is not significantly improved by the addition of a broad component. Data for this galaxy are shown in Figure 10 (see key in Figure 1 for an explanation of these plots).

NGC 3862 (UGC 6723) This elliptical galaxy has a nuclear dust disk (b/a ∼ 0.99). It has a core-jet radio morphology on VLBA and VLA scales. The STIS slits were aligned approximately perpendicular to the radio jet as the nuclear isophotal position angles are poorly constrained. The central kinematic and flux properties are listed in Table 15; the gas

– 12 –

does not exhibit a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component which appears to represent a non-flat continuum in this case. Data for this galaxy are shown in Figure 11 (see key in Figure 1 for an explanation of these plots).

UGC 7115 This elliptical galaxy has a nuclear dust disk (b/a ∼ 0.95). It has a core-jet radio morphology on VLA scales. The STIS slit were aligned approximately perpendicular to the radio jet as the nuclear isophotal position angles are poorly constrained, a certain degree of freedom was allowed in slit placement to allow reasonable observing windows. This galaxy was observed in only one slit position, as we also required WFPC2 observations of this target in order to measure the central photometric properties (see Verdoes Kleijn, et al. 2002). The central kinematic and flux properties are listed in Table 16; the gas exhibits a regular rotation profile. The fit to the central spectrum is not significantly improved by the addition of a broad component. Data for this galaxy are shown in Figure 12 (see key in Figure 1 for an explanation of these plots).

NGC 4261 (UGC 7360) This E2-3 galaxy has a nuclear dust disk (b/a = 0.46). It has a twin-jet radio morphology on VLBA and VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 17. The nucleus of this galaxy lies closer to one of the side slits (slit one) than the central position, however it is still possible to see a clear rotation curve along that slit. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 13 (see key in Figure 1 for an explanation of these plots).

NGC 4335 (UGC 7455) This elliptical galaxy has a nuclear dust disk (b/a = 0.41). It has a radio core on VLBA scales and a twin-jet morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 18; the gas exhibits a regular rotation profile. In the positive offset side slit there is a dip in the velocity dispersion profile at the position closest to the nucleus. See also Verdoes Kleijn, et al. (2002). The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 14 (see key in Figure 1 for an explanation of these plots).

NGC 4374 (M84; UGC 7494) This E1 galaxy has a nuclear dust lane (width : length = 0.15). It has a core-jet radio morphology on VLBA scales, and a twin-jet morphology on VLA scales. The STIS slits were aligned approximately perpendicular to the radio jets,

– 13 –

which lies close to the major axis of the emission line gas. The central kinematic and flux properties are listed in Table 19; the gas exhibits a regular rotation profile. See also Bower, et al. (1998). The fit to the central spectrum is not significantly improved the addition of a broad component. Data for this galaxy are shown in Figure 15 (see key in Figure 1 for an explanation of these plots).

NGC 4486 (M87; UGC 7654) This elliptical galaxy has an irregular nuclear dust morphology. It has a core-jet radio morphology on VLBA and VLA scales. The STIS slits were aligned to trace morphological features in the emission line gas across the nuclear region of this galaxy. The central kinematic and flux properties are listed in Table 20; the gas exhibits a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 16 (see key in Figure 1 for an explanation of these plots).

NGC 5127 (UGC 8419) This elliptical peculiar galaxy has a nuclear dust lane (width : length = 0.25). It has a radio core on VLBA scales and a twin-jet morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 21; the gas exhibits a regular rotation profile. The fit to the central spectrum is not significantly improved by the addition of a broad component. Data for this galaxy are shown in Figure 17 (see key in Figure 1 for an explanation of these plots).

NGC 5141 (UGC 8433) This S0 galaxy has a nuclear dust lane (width : length = 0.25). It has a core-jet radio morphology on VLBA scales and a twin-jet morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 22; the gas exhibits a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 18 (see key in Figure 1 for an explanation of these plots).

NGC 5490 (UGC 9058) This elliptical galaxy has a nuclear dust lane (width : length = 0.35). It has a core-jet radio morphology on VLBA scales and a twin-jet morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 23; the gas does not exhibit a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 19 (see key in Figure 1 for an explanation of these plots).

– 14 –

NGC 7052 (UGC 11718) This elliptical galaxy has a nuclear dust disk (b/a = 0.30). It has a twin-jet radio morphology on VLBA scales and a core-jet morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 24; the gas exhibits a regular rotation profile. The fit to the central spectrum is not significantly improved by the addition of a broad component. Data for this galaxy are shown in Figure 20 (see key in Figure 1 for an explanation of these plots).

UGC 12064 This S0 galaxy has a nuclear dust disk (b/a = 0.54). It has a twin-jet radio morphology on VLA scales. The STIS slits were aligned parallel to the dust disk major axis. The central kinematic and flux properties are listed in Table 25; the gas exhibits a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 21 (see key in Figure 1 for an explanation of these plots).

NGC 7626 (UGC 12531) This elliptical peculiar galaxy has a nuclear dust lane (width : length = 0.17). It has a core-jet radio morphology on VLBA scales and a twin-jet morphology on VLA scales. The STIS slits were aligned parallel to the galaxy major axis. The central kinematic and flux properties are listed in Table 26; the gas exhibits a regular rotation profile. The fit to the central spectrum is improved by the addition of a broad component. Data for this galaxy are shown in Figure 22 (see key in Figure 1 for an explanation of these plots).

5. Interpretation and Discussion

In our initial interpretation we have focussed on understanding the general parameters of the data set. We will undertake more detailed analyses in future work that we outline in §6 below. Here, we first describe the categorization of sources as rotating and non-rotating systems based on the observed kinematics (§5.1). We then discuss the ionization states of the nuclear regions (§5.2). We go on to discuss the presence of broad components in these nuclei and a more detailed analysis of the line shapes (§5.3).

5.1. Rotators and non-rotators

By inspecting maps of the central kinematics and the velocity profiles along each slit (as presented above in figures 2 to 22), we have classified, by eye, the galaxies into two

– 15 –

classes: rotators and non-rotators. Rotators are systems where we see patterns reminiscent of rotation curves; in non-rotators we find no such patterns - the kinematics seem either irregular or organized in some manner that does not represent regular rotation. We do not include NGC 741 in discussions of kinematics as very few points were well fit during our analysis. We classify 67% (N = 14/21) of the UGC FR-I galaxies as rotators. 73% of galaxies with dust disks (N = 8/11), 100% of galaxies with dust lanes (N = 5/5) and 50% of galaxies with complex dust or no dust (N = 2/4) are rotators.

We have made use of the mean velocity dispersion

σ_{100pc} = 1 N ∑ i σ_i : x_i ≤ 100pc, (6)

and the difference in mean velocities on each side of the nucleus

Δ_{100pc} = | | | | | ( 1 N_1 ∑ i v_i : −100pc ≤ x_i < 0 ) − ( 1 N_2 ∑ j v_j : 0 < x_j ≤ 100pc )| | | | (7)

within 100 pc of the brightest pixel as illustrative of the global kinematic parameters along the central slit^9. These parameters are shown in Table 31 for each galaxy, along with the mean properties for each class of galaxy. In Figure 23 we show the relationship between the two parameters for each galaxy. It is clear that the non-rotators lie at the bottom of the Δ_{100pc} distribution, so it is conceivable that irregular motions conceal any remaining signs of rotation in these cases. We note that we detect rotation in all cases where the disk is ≳ 25^∘ from face on, other than those cases where the dust morphology is highly irregular. The only exception is NGC 5490 where the signal to noise was particularly poor.

In Figure 24 we show the values of Δ_{100pc} plotted as a function of dust disk axis ratio, or dust lane width to length ratio; if the dust were all in circular disks this would be an indicator of disk inclination. We included lines showing an indication of the projection of several values of Δ_{100pc} at different disk inclinations through the relation

Δ_{obs} ≈ Δ_{int}.sini ≈ Δ_{int} × √ 1 − ( b a )_2

, (8)

9For NGC 4261 we used the offset slit closest to the nucleus as explained above.

– 16 –

Where Δ_{obs} is the observed Δ_{100pc} parameter at a given inclination, Δ_{int} is the presumed intrinsic rotation of the disk and b/a is the axis (or width:length) ratio. This is not a rigorously valid means of projecting these values, but it serves our purposes of illustration here.

It is easy to see that the non-rotators with face on disks would have to be intrinsically rotating very fast for their rotation to register over the random motions in these cases. From the observations of systems at greater inclinations we have no cause to expect any disks to be rotating that fast. In a similar manner we plot the values of σ_{100pc} against dust disk axis ratio, or dust lane width to length ratio in Figure 25. Here we see no clear trend in velocity dispersion with axis ratio.

We find no significant systematic differences between the typical values σ_{100pc} between the two classes. Using the Kolmogorov-Smirnov Test to assess the two groups we find a probability of 0.93 that the distributions of velocity dispersions were drawn from the same underlying distribution. Applying the same test to the Δ_{100pc} parameter gives only a 0.08 probability that these were drawn from the same distribution.

This evidence suggests to us that rotators and non-rotators represent the same type of kinematic systems, with observational effects such as inclination and dust properties limiting our ability to detect the rotation of those systems where we do not. We conclude that a model of a rotating gas disk with significant random motions is compatible with all of the observations.

5.2. Flux ratios and ionization

In Figure 26 we show the [N II] flux as a function of Hα narrow line flux for each central spectrum. The values are compatible with values typically found for photo-ionization and shock models (see, for example, Dopita, et al. 1997). The unusually low ratios shown in two nuclei (NGC 383 and M84) are likely a consequence of the high degree of blending of the lines in these observations (see panel (d) of Figures 4 and 15), rather than any underlying physics.

While we are satisfied that our data have not produced any results that are incompatible with reasonable parameters, detailed modeling is required to understand the various ionization mechanisms at work in each individual case. We intend to undertake this type of modeling and present the outcomes in future work.

– 17 –

5.3. Are we observing broad lines?

The fit to the central spectrum is improved in 62% of the galaxies by the inclusion of an additional free Gaussian component (see §4.2). Each of these fits resulted in the supplementary component being centered redwards of the Hα line with a velocity dispersion between about two and ten times that of the narrow lines; thus we describe this feature as a broad fit component. We identify these broad components in 73% of galaxies with dust disks (N=8/11), 60% of galaxies with dust lanes (N=3/5), 67% of galaxies with irregular dust (N=2/3) and 0% of galaxies with no dust (N=0/2).

If we make a flux cut in Hα we find broad components in 40% of nuclei with 1 × 10^{−15} ≤ F (Hα) ≤ 1 × 10^{−14}, in 55% of nuclei with 1 × 10^{−14} ≤ F (Hα) ≤ 5 × 10^{−14} and in 100% of nuclei with F (Hα) ≥ 5 × 10^{−14}. This detection trend with flux is reflected in Figure 26. This suggests that the detection of nuclear broad components is somewhat flux (and therefore signal to noise) dependent across the sample.

The broad components could originate either as an artifact of attempting to fit Gaussians to non-Gaussian line profiles, or from a physical source – such as a broad line region or a change in the characteristics of the gas as the inner regions of the disk are approached.

We detect broad components only in the central few pixels, this could be a consequence of either the fall in signal to noise or that the component is an unresolved source. It is important to note as a consequence of this, that fitting single Gaussians to each line samples a different part of the line shape as the central pixels are approached.

In Table 32 we show the mean properties of the broad components and compare them to the samples of LINERS by Ho, et al. (1997) and Radio Galaxies summarized by Sulentic, et al. (2000). These comparisons show that our broad components are compatible with the broad lines seen in LINERs and that the observed offsets from the narrow line components are compatible with those observed in samples of radio loud galaxies.

5.4. Constraining the line shapes

In order to better establish the line shape, we investigated the profiles from the nucleus of NGC 4335, which has a relatively good signal to noise and relatively non-blended lines (Verdoes Kleijn, et al. 2002).

We first investigated the profile of the two [S II] lines, as they are less entangled than the Hα + [N II] complex. We fit these two lines with a varying number of Gaussians per line. The minimum in the reduced χ^2 parameter resulting from each of these fits lay between

– 18 –

two and three Gaussians per line. We extended the two Gaussian per line model to fit the entire profile of the five emission lines. By then testing various sets of free parameters we were able to discover an optimal set.

Fitting these models quickly illustrated that the additional broad component is a very strongly favored feature; in any case where it was possible for the parameters to contrive to create a broad component they did so. Table 33 shows the kinematic parameters and reduced χ^2 values from five combinations of fit parameters that produce distinct fits. These were:

1. Narrow lines only: The original 5 Gaussian model (one Gaussian for each of the following 5 lines: [N II]_{6550}, Hα, [N II]_{6585}, [S II]_{6718}, [S II]_{6733}), with a single value of velocity and velocity dispersion for all lines.

2. Additional broad component: The same as the Narrow lines only model, with an additional broad component, with an independent velocity, velocity dispersion and flux.

3. Flux-constrained Broad Bases (i): The same as model 2, with an additional set of 5 Gaussians, representing the broader wings (Broad Bases). This new set of lines had a single velocity and velocity dispersion and the velocity was fixed to be the same as for the other lines. The fluxes of each line in the second set of Gaussians was fixed at a constant ratio to its counterpart in the first set, based on the mean ratio measured in the fit of two Gaussians per line to the two [S II] lines as described above.

4. Flux-constrained Broad Bases (ii): The same as model 3, however in this case the velocity of the set of broad bases was allowed to vary from that of the narrow lines.

5. Flux-unconstrained Broad Bases: the same as model 3, however in this case the lines in both sets were able to vary independently in flux, other than the fixed 1:3 ratio between the two [N II] lines in each set.

We conclude, as the Flux-constrained Broad Bases (ii) model not only produces the most satisfying fit judged by eye, but also the lowest reduced χ^2 value, that this model is likely to most closely represent the line profile present in the central regions. The broad bases in this case are able to represent an asymmetric red wing on each line, but they do not reduce the importance of the broad component in the fit.

– 19 –

6. Conclusions

In this paper we presented the medium resolution spectra of the 21 galaxies in our UGC FR-I sample, obtained by ourselves and others using STIS. Data were obtained for three parallel slit positions on each nucleus (other than UGC 7115, which was observed in only one slit position).

We find that all nuclei are compatible with a single kinematic description: a rotating gas disk, where random motions are always important. We observe patterns reminiscent of rotation in 67% of the nuclei, in the remainder the non-detection can be accounted for as the systems are either face on, have complex central morphologies (as judged from the nuclear dust distribution) or, in the case of NGC 5490, particularly poor signal to noise.

We find that the inclusion of an additional fit component with unconstrained parameters improves our fit to the nuclear spectrum in 62% of the galaxies, where it fits in every case as a broad component in the vicinity of Hα and [N II]. The detection of the broad component is related to the line flux (and therefore the signal to noise). The broad components have a mean velocity dispersion of 1349 ± 345 km s^{−1} and are redshifted from the narrow line components (assuming an origin in Hα) by 486 ± 443 km s^{−1}.

The broad component could be a consequence of non-Gaussian line profiles with broad wings, which would be biased toward the brightest [N II] line (redwards of Hα). However, our more detailed analysis of line shape shows that it is very hard to reproduce this effect by including broad (even asymmetric) wings on each line, suggesting the broad component may indeed have a physical origin.

The measured Hα to [N II] ratios for the narrow components in the central spectra are consistent with standard photo-ionization or shock-ionization models (for example, Dopita, et al. 1997) other than two examples where the lines are highly blended and may be leading us to misleading fits in the very center.

As we continue with this research we will next model the galaxies with thin disks and with spherical gas distributions (see, for example, Verdoes Kleijn, et al. 2002) in order to obtain estimates of the black hole masses for each galaxy in this complete sample. We will also extend our investigation into the ionization profiles of each nucleus; investigating the ionization properties of each nucleus and seeking the signs of jet / disk interactions.

The authors would like to thank Jacqueline van Gorkom for her very valuable comments on this work.

Support for this work was provided by NASA through grant number HST-GO-08236.01-

– 20 –

A from the Space Telescope Science Institute, which is operated by the Association of Universities for Research in Astronomy, Inc., under NASA contract NAS5-26555.

This research has made use of the NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration.

REFERENCES Barth, A. J., Sarzi, M. R., Rix, H.-W., Ho, L. C., Filippenko, A. V., & Sargent, W. L. W.

2001, ApJ, 555, 685 Bower, G. A. et al. 1998, ApJ, 492, L111 Brown, T. et al. 2002, in HST STIS Data Handbook, version 4.0, ed. B. Mobasher, Baltimore, STScI Condon, J. J., Broderick, J. J. 1988, AJ, 96, 30 Davies, R. L., et al. 1987, ApJS, 64, 581 Di Nella H., Garcia A.M., Garnier R., & Paturel G. 1995, A&AS, 113, 151 Doptia, M. A., Koratkar, A. P., Allen, M. G., Tsvetanov, Z. I., Ford, H. C., Bicknell, G. V., & Sutherland, R. S. 1997, ApJ, 490, 202 Fanaroff, B. L., & Riley, J. M. 1974, MNRAS, 167, 31P Ferrarese, L., Ford, H. C., & Jaffe, W. 1996, ApJ, 470, 444 Ferrarese, L. C., & Ford, H. C. 1999, ApJ, 515, 583 Ferrarese, L., & Merritt, D. 2000, ApJ, 539, 9 Gebhardt, K., et al. 2000, ApJ, 539, 13 Goudfrooij, P., Hansen, L., Jørgensen, H. E., & Nørgaard-Nielsen, H. U. 1994, A&AS, 105, 341 Hardcastle, M. J., Alexander, P., Pooley, G. G., Riley, J. M. 1998, MNRAS, 296, 445 Harms, R. J., et al. 1994, ApJ, 435, 35 Heckman, T. M., Van Breugel, W., Miley, G. K., Butcher, H. R. 1983, AJ, 88, 1077

– 21 –

Ho, L. C., Filippenko, A. V., Sargent, W. L. W., & Peng, C. Y. 1997, ApJS, 112, 391 Jørgensen, I., Franx, M., & Kjærgaard, P. 1995, MNRAS, 276, 1341 Kimble, R., et al. 1998, ApJ, 539, 13 Kormendy, J., & Richstone, D. 1995, ARA&A, 33, 581 Macchetto, F., et al. 1997, ApJ, 489, 579 Maciejewski, W., Binney, J. 2001, MNRAS, 323, 831 Merritt, D., & Ferrarese, L. 2001, ApJ, 547, 140 Nilson, P. 1973, The Uppsala General Catalogue of Galaxies [UGC], (Uppsala: Astronomiska Observatorium) Osterbrock, D. E. 1989, Astrophysics of gaseous nebulae and active galactic nuclei, (Mill Valley, CA: University Science Books) Philips, M. M., Jenkins, C. R., Dopita, M. A., Sadler, E. M., & Binette, L. 1986, AJ, 91, 1062 Press, W. H., Teukolsky, S. A., Vetterling, W. T., Flannery, B. P. 1992, Numerical Recipies in Fortran, 2nd Edition (Cambridge: Cambridge University Press) Reader, J., & Corliss, C. H., Eds. 1998, CRC Handbook of Chemistry and Physics, 79th Edition, (Boca Raton, FL: CRC) Rees, M. 1984, ARA&A, 22, 471 Sarzi, M., Rix, H.-W., Shields, J. C., Rudnick, G., Ho, L. C., McIntosh, D. H., Filippenko, A. V., & Sargent, W. L. W. 2001, ApJ, 550, 65 Shaw, D., & Hodge, P. 1998, STIS Instrument Science Report 98-22, (Baltimore, MD: Space Telescope Science Institute) Sulentic, J. W., Marziani, P., & Dultzin-Hacyan, D. 2000, ARA&A, 38, 521 Tonry J.L., & Davis M. 1981, ApJ, 246, 666 Tran, H. D., Tsvetanov, Z., Ford, H. C., Davies, J., Jaffe, W., van den Bosch, F. C., & Rest, A. 2001, AJ, 121, 2928 Tremaine, S., et al. 2002, ApJ, 574, 740

– 22 –

Xu, C., Baum, S. A., O’Dea, C. P., Wrobel, J. M., & Condon, J. J. 2000, AJ, 120, 2950 van der Marel, R. P., & van den Bosch, F. C. 1998, AJ, 116, 2220 van Dokkum, P. G., & Franx, M. 1995, AJ, 110, 2027 Verdoes Kleijn, G. A., Baum, S. A., de Zeeuw, P. T., & O’Dea, C. P. 1999, AJ, 118, 2592 Verdoes Kleijn, G. A., van der Marel, R. P., Carollo, C. M., & de Zeeuw, P. T. 2000, AJ, 120, 1221 Verdoes Kleijn, G. A., Baum, S. A., de Zeeuw, P. T., & O’Dea, C. P. 2002, AJ, 123, 1334 Verdoes Kleijn, G. A., van der Marel, R. P., de Zeuww, P. T., Noel-Storr, J., & Baum, S. A.

2002, AJ, 124, 2524 Wagner, S. J., Bender, R., Möllenhof, C. 1988, A&A, 195, L5 Wallerstein, G., Gilroy, K. K., Zethson, T., Johansson, S., & Hamann, F. 2001, PASP, 113, 1210

This preprint was prepared with the AAS L^ATEX macros v5.0.

– 23 –

Fig. 1.— Key to plots. Region (a): the HST acquisition image for each galaxy observed is shown with the positions of the observed long slits overlaid. The relative position angles of the galaxy major axes measured from the central isophotes (dashed lines) and the arcsecond scale radio jets (dotted lines) are shown. These lines cross, and a North-East indicator is drawn, at the location of the central pixel (see text). Region (b): (i) the central portion of the reduced 2-D spectrum from the central slit position is shown along with (ii) an image created from fitting a set of 5 Gaussian lines to the same. Region (c): plots representing the two-dimensional distributions of parameters measured by fitting a one Gaussian per emission line model to spectra from the nuclear region. The dashed and dash-dot lines indicate the directions of the minor and major axes respectively. The lines cross at the location of the central pixel. We show: (i) radial velocity (filled circles represent velocities greater than the mean, empty circles represent velocities less than the mean and the radius of each point [i,j] is proportional to |v_{i,j} − v_{mean}|); (ii) velocity dispersion (the radius of the circle is proportional to σ_{i,j} ); (iii) integrated line flux (the area of each point is proportional to F_{i,j}); and (iv) [N II]_{6585} / Hα ratio (The radius of each circle is proportional to log(F([N II]_{6585})/F(Hα))). Region (d): single Gaussian per line fit and residuals without (i) and with (ii) the additional free component described in the text for the central spectrum of each galaxy. Region (e): plots of (i) radial velocity, (ii) velocity dispersion, (iii) [N II] line flux and (iv) [N II]_{6585} / Hα ratio along each slit measured by fitting a one Gaussian per line model to the emission line spectra. The vertical dotted line indicates the Y position of the central row. The dash-dot line in the velocity panel indicates the quoted recession velocity for the galaxy (see Table 1).

– 24 –

Fig. 2.— Observation and fit data for NGC 193, see Figure 1 for description.

– 25 –

Fig. 3.— Observation and fit data for NGC 315, see Figure 1 for description.

– 26 –

Fig. 4.— Observation and fit data for NGC 383, see Figure 1 for description.

– 27 –

Fig. 5.— Observation and fit data for NGC 541, see Figure 1 for description.

– 28 –

Fig. 6.— Observation and fit data for NGC 741, see Figure 1 for description.

– 29 –

Fig. 7.— Observation and fit data for UGC 1841, see Figure 1 for description.

– 30 –

Fig. 8.— Observation and fit data for NGC 2329, see Figure 1 for description.

– 31 –

Fig. 9.— Observation and fit data for NGC 2892, see Figure 1 for description.

– 32 –

Fig. 10.— Observation and fit data for NGC 3801, see Figure 1 for description.

– 33 –

Fig. 11.— Observation and fit data for NGC 3862, see Figure 1 for description.

– 34 –

Fig. 12.— Observation and fit data for UGC 7115, see Figure 1 for description.

– 35 –

Fig. 13.— Observation and fit data for NGC 4261, see Figure 1 for description.

– 36 –

Fig. 14.— Observation and fit data for NGC 4335, see Figure 1 for description.

– 37 –

Fig. 15.— Observation and fit data for NGC 4374, see Figure 1 for description.

– 38 –

Fig. 16.— Observation and fit data for NGC 4486, see Figure 1 for description.

– 39 –

Fig. 17.— Observation and fit data for NGC 5127, see Figure 1 for description.

– 40 –

Fig. 18.— Observation and fit data for NGC 5141, see Figure 1 for description.

– 41 –

Fig. 19.— Observation and fit data for NGC 5490, see Figure 1 for description.

– 42 –

Fig. 20.— Observation and fit data for NGC 7052, see Figure 1 for description.

– 43 –

Fig. 21.— Observation and fit data for UGC 12064, see Figure 1 for description.

– 44 –

Fig. 22.— Observation and fit data for NGC 7626, see Figure 1 for description.

– 45 –

Fig. 23.— Difference in mean velocity within 100 pc of each side of the nucleus (Δ_{100pc}, see text) as a function of the mean gas velocity dispersion within 100 pc of the nucleus (σ_{100pc}). The different kinematic classes and dust morphologies are indicated. Filled symbols represent rotators: with dust disks (•), with dust lanes (■) or with irregular dust (▲); Empty symbols represent non-rotators: with dust disks (∘), with dust lanes (□) or with no-dust or irregular dust (△). The solid line is the 1:1 ratio between Δ_{100pc} and σ_{100pc}, indicating regions where organized motions (above the line) or random motions (below the line) dominate.

– 46 –

Fig. 24.— Difference in mean velocity within 100 pc of each side of the nucleus (Δ_{100pc}, see text) as a function of dust disk axis ratio (b/a) or dust lane width : length ratio, which is an indicator of inclination. The different kinematic classes and dust morphologies are indicated. Filled symbols represent rotators: with dust disks (•), with dust lanes (■) or with irregular dust (▲); Empty symbols represent non-rotators: with dust disks (∘), with dust lanes (□) or with no-dust or irregular dust (△). The solid lines are loci for disks with the same intrinsic Δ_{100pc} (990, 680 and 360 km s^{−1}) viewed at inclinations projected assuming b/a = sin i (i.e. a circular disk).

– 47 –

Fig. 25.— Mean gas velocity dispersion within 100 pc of the nucleus (σ_{100pc}) as a function of dust disk axis ratio (b/a) or dust lane width : length ratio, which is an indicator of inclination. The different kinematic classes and dust morphologies are indicated. Filled symbols represent rotators: with dust disks (•), with dust lanes (■) or with irregular dust (▲); Empty symbols represent non-rotators: with dust disks (∘), with dust lanes (□) or with no-dust or irregular dust (△).

– 48 –

Fig. 26.— [N II] against Hα fluxes for the UGC FR-I sample members. Formal errors in the fluxes are shown. The shading of the symbols indicates the score assigned to the broad component in each case (see text). A score of 3 (most confident) is shown by black symbols, through to white symbols for a score of zero (no confidence in a broad line). It is possible to see a trend with flux from less to more confidence in broad-line detection.

Table 1. Properties of the galaxy sample members.

NGC UGC Other Names Type v_{sys} STIS Scale M_B log(L_{1400}) Axis Ratio (km s^{−1}) (pc/pixel) (mag) (W Hz^{−1}) b/a (1) (2) (3) (4) (5) (6) (7) (8) (9)

193 408 E-S0 4342.5 15.0 -21.0 23.93 (0.18) 315 597 E 5092.5 17.6 -22.6 24.10 0.23 383 689 3C 31 E-S0 4890.0 16.9 -22.2 24.51 0.77 541 1004 E 5497.5 19.0 -21.7 23.94 0.91 741 1413 E 5265.0 18.2 -22.6 23.85 · · · 1841 3C 66B E 6360.0 22.0 -22.5 24.94 ∼ 0.98 2329 3695 E-S0 5725.0 19.8 -21.9 23.76 0.68 2892 5073 E 6810.0 23.6 -21.1 23.36 · · · 3801 6635 S0 3255.0 11.3 -20.8 23.49 (0.12) 3862 6723 3C 264 E 6330.0 21.9 -21.7 24.75 ∼ 0.99 7115 E 6787.5 23.5 -21.0 23.94 ∼ 0.95 4261 7360 3C 270 E 2212.5 7.7 -21.5 24.40 0.46 4335 7455 E-S0 4672.5 16.2 -21.6 23.11 0.41 4374 7494 M84, 3C 272.1 S0 1155.0 4.0 -20.9 23.35 (0.15) 4486 7654 M87, 3C 274 E 1155.0 4.0 -22.2 24.90 · · · 5127 8419 E 4830.0 16.7 -21.3 24.08 (0.25) 5141 8433 S0 5302.5 18.4 -21.0 23.80 (0.25) 5490 9058 E 5790.0 20.1 -21.7 23.79 (0.35) 7052 11718 E 4155.0 14.4 -21.0 23.04 0.30 12064 3C 449 E-S0 5122.5 17.7 -20.8 24.38 0.54 7626 12531 E 3495.0 12.1 -21.7 23.37 (0.17)

Note. — Col. (1): NGC number where available; Col. (2): Upsalla General Catalog (UGC) number; Col. (3): Alternative names; Col. (4): From the NASA Extragalactic Database (NED); Col. (5): Measured from the stellar kinematics (from NED); Col. (6): Parsecs per unbinned STIS pixel; Col. (7): Absolute blue magnitude from Condon & Broderick (1988); Col. (8): Radio Luminosity from Condon & Broderick (1988); Col. (9): Dust disk axis ratio from Verdoes Kleijn, et al. (1999), numbers in parentheses indicate a dust lane where the width:length ratio is given instead. All physical parameters assume H_0 = 70 kms^{−1}Mpc^{−1}

Table 2. HST-STIS G750M observing log for this program.

Galaxy Visit ID Aperture Offsets Exposure times Brightest Row (^{′′}) (seconds) (1) (2) (3) (4) (5) (6)

NGC 193 o5ee01 52x0.2 -0.20, 0.00, +0.20 1700, 1300, 1560 300 NGC 315 o5ee02 52x0.1 -0.10, 0.00, +0.10 1082, 1000, 1098 598 NGC 383 o5ee03 52x0.1 -0.10, 0.00, +0.10 1082, 1000, 1098 599 NGC 541 o5ee04 52x0.2 -0.20, 0.00, +0.20 1442, 1300, 1500 300 NGC 741 o5ee05 52x0.2 -0.20, 0.00, +0.20 1667, 1145, 1500 300 UGC 1841 o5ee06 52x0.2 -0.20, 0.00, +0.20 1870, 1300, 1560 300 NGC 2329 o5ee07 52x0.2 -0.20, 0.00, +0.20 1967, 1245, 1560 300 NGC 2892 o5ee09 52x0.2 -0.20, 0.00, +0.20 2037, 1300, 1560 299 NGC 3801 o5ee10 52x0.2 -0.20, 0.00, +0.20 1699, 1292, 1560 305 NGC 3862 o5ee11 52x0.2 -0.20, 0.00, +0.20 900, 731, 1066 300 UGC 7115 o5ee22 52x0.2 0.00 2058 299 NGC 4261 o5ee12 52x0.1 -0.10, 0.00, +0.10 994, 1000, 1000 601 NGC 4335 o5ee13 52x0.2 -0.20, 0.00, +0.20 2154, 1300, 1560 300 NGC 4374 o3wn01 52x0.2 -0.20, 0.00, +0.20 2245, 2600, 2600 600 NGC 4486 o67z01/2 52x0.2 -0.20, 0.00, +0.20 1708, 1380, 1708 601 NGC 5127 o5ee15 52x0.2 -0.20, 0.00, +0.20 1660, 1000, 1500 303 NGC 5141 o5ee16 52x0.2 -0.20, 0.00, +0.20 1968, 1300, 1560 300 NGC 5490 o5ee17 52x0.2 -0.20, 0.00, +0.20 1590, 1300, 1560 299 NGC 7052 o5ee18 52x0.1 -0.10, 0.00, +0.10 1747, 1300, 1500 600 UGC 12064 o5ee20 52x0.1 -0.10, 0.00, +0.10 1532, 1000, 1500 599 NGC 7626 o5ee19 52x0.2 -0.20, 0.00, +0.20 1905, 1263, 1560 300

Note. — Col. (1): NGC/UGC Number; Col. (2): Root name for the HST visit and data sets; Col. (3): HST/STIS aperture used; Col. (4): Slit positions with offsets perpendicular to the slit direction, given relative to the central slit position. UGC 7115 was observed in only one position. Further data not included here is available for NGC 4374 (M84) and NGC 4486 (M87); Col. (5): Exposure times in each offset position. For each position two observations were obtained separated by 0.^{′′}2028 along the direction of the slit, the combined exposure time is shown; Col. (6): Row number in the final x2d file of the brightest row.

Table 3. HST/STIS Instrumental properties for the configurations used.

Grating Aperture Slit Width Binning Central λ Wavelength Covered λ Scale Spatial Scale (^{′′}) (Å) (Å ... Å) (Å/ pixel) (^{′′}/ pixel) (1) (2) (3) (4) (5) (6) (7) (8)

G750M 52x0.1 0.1 2 × 1 6768 6482 ... 7054 1.108 0.05 G750M 52x0.2 0.2 2 × 2 6768 6482 ... 7054 1.108 0.1 G750M 52x0.2 (M84) 0.2 1 × 1 6581 6295 ... 6867 0.554 0.05 G750M 52x0.2 (M87) 0.2 1 × 1 6581 6295 ... 6867 0.554 0.05

Note. — Col. (1): HST/STIS Grating Used; Col. (2): HST/STIS Aperture Used; Col. (3): The slit width of the chosen aperture; Col. (4): The degree of on chip binning used given as binaxis1× binaxis2 (wavelength by spatial binning); Col. (5): The set central wavelength; Col. (6): The minimum and maximum wavelengths on the CCD chip at that central wavelength position; Col. (7) The wavelength scale per binned pixel; Col. (8) The spatial scale per binned pixel. Further details of HST/STIS configurations can be found in Kimble, et al. (1998).

Table 4. Position angles of various axes.

Galaxy Major Axis Radio Axis Dust Axis STIS Slits Target ΔP A (^∘N → E) (^∘N → E) (^∘N → E) (^∘N → E) (^∘) (1) (2) (3) (4) (5) (6) (7)

NGC 193 58 104 0 57.9 ‖ M.Ax. 0.1 NGC 315 39 130 40 -143.8 ‖ M.Ax. 2.8 NGC 383 144 162 138 144.1 ‖ M.Ax. 0.1 NGC 541 143 76 · · · -85.6 · · · · · · NGC 741 92 · · · · · · -107.4 ‖ M.Ax.^† 19.4 UGC 1841 91 50 · · · 90.0 ‖ M.Ax. 1.0 NGC 2329 171 150 174 170.8 ‖ M.Ax. 0.2 NGC 2892 164 52 · · · 142.0 ‖ M.Ax.^† 22.0 NGC 3801 121 121 24 121.1 ‖ M.Ax. 0.1 NGC 3862 25 30 · · · 122.3 ⊥ Jet 2.3 UGC 7115 91 116 175 -174.4 ⊥ Jet^† 20.4 NGC 4261 155 87 163 157.9 ‖ M.Ax. 2.9 NGC 4335 156 82 158 -32.5 ‖ M.Ax. 8.5 NGC 4374 128 1 79 104.0 ⊥ Jet 13.0 NGC 4486 128 112 · · · 164.7 · · · · · · NGC 5127 68 118 48 68.0 ‖ M.Ax. 0.0 NGC 5141 65 12 88 71.9 ‖ M.Ax. 6.9 NGC 5490 1 75 143 -173.9 ‖ M.Ax. 5.1 NGC 7052 64 23 65 63.6 ‖ M.Ax. 0.4 UGC 12064 39 11 171 170.6 ‖ Dust 0.4 NGC 7626 171 44 167 170.8 ‖ M.Ax. 0.2

Note. — Col. (1): NGC/UGC Name; Col. (2): Position angles of the major axes just outside the central dust distributions; Col. (3): Position angles of the radio jet axes on arcsecond scales or smaller; Col. (4): Position angles of the central dust distributions; Col. (5): Position angles of the STIS slits on the nucleus; Col. (6): The target orientation of the STIS slits (‖ M.Ax.: Parallel to the Major Axis; ‖ Dust: Parallel to the Dust Axis; ⊥ Jet: Perpendicular to the radio jet;^† Additional flexibility allowed to reduce scheduling constraints); Col. (7): Offset in degrees of the STIS slits from the target orientation.

References. — Data for Columns 3 - 5 taken from Verdoes Kleijn, et al. (1999)

Table 5. Spectral Lines in the region of Hα.

Ion Ref. Transition λ_{air} λ_{vac} (Å) (Å) (1) (2) (3) (4) (5)

[N II] (a)^3P_1 −^1 D_2 6548.05 6549.86 Hα (b) 6562.80 6564.61 [N II] (a)^3P_2 −^1 D_2 6583.39 6585.21 [S II] (a)^4S_{3/2} −^2 D_{5/2} 6716.44 6718.29 [S II] (a)^4S_{3/2} −^2 D_{3/2} 6730.81 6732.67

Note. — Col. (1): Ion responsible for the line; Col. (2): Wavelength reference; Col. (3): Transition configuration terms; Col. (4): Air wavelength; Col. (5): Vacuum wavelength. Note that the value for Hα is computed from the intensity weighted mean of fine structure lines at λ_{air} = 6562.7247 and λ_{air} = 6562.8516 with relative intensities of 120 and 180 respectively.

References. — (a) Wallerstein, et al. (2001); (b) Reader & Corliss (1998)

Table 6. NGC 193: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

2 -0.9128 4334 ± 30 135 ± 30 6.6 ± 2.9 1.7 ± 0.9 1.2 ± 0.7 3.79 3 -0.8114 4270 ± 30 121 ± 32 6.9 ± 3.3 1.5 ± 1.0 0.2 ± 0.3 3.17 4 -0.7099 4323 ± 22 124 ± 23 10.6 ± 4.0 1.5 ± 0.7 0.1 ± 0.2 3.90 5 -0.6085 4390 ± 7 40 ± 7 7.8 ± 2.3 1.4 ± 0.6 0.1 ± 0.2 3.23 6 -0.5071 4602 ± 42 233 ± 41 12.9 ± 4.5 0.0 ± 0.3 1.8 ± 0.8 2.83 7 -0.4057 4371 ± 10 67 ± 10 7.4 ± 2.3 1.5 ± 0.6 1.2 ± 0.5 3.67 8 -0.3043 4402 ± 9 48 ± 9 6.2 ± 2.2 1.1 ± 0.5 0.9 ± 0.5 3.46 9 -0.2028 4369 ± 23 210 ± 18 24.7 ± 4.4 1.2 ± 0.3 1.3 ± 0.3 3.28 10 -0.1014 4344 ± 9 132 ± 9 12.5 ± 2.8 2.9 ± 0.7 3.0 ± 0.7 3.49 11 0.0000 4336 ± 7 121 ± 7 18.3 ± 2.8 2.8 ± 0.5 2.2 ± 0.4 3.66 12 0.1014 4340 ± 8 128 ± 8 18.6 ± 2.9 2.7 ± 0.5 1.6 ± 0.3 3.50 13 0.2028 4374 ± 6 85 ± 6 18.0 ± 2.7 1.8 ± 0.3 1.1 ± 0.2 3.11 14 0.3043 4343 ± 7 86 ± 7 19.2 ± 3.1 1.3 ± 0.3 1.0 ± 0.2 2.77 15 0.4057 4298 ± 14 97 ± 14 8.0 ± 2.6 2.6 ± 1.0 0.2 ± 0.3 2.52 16 0.5071 4309 ± 10 64 ± 10 8.0 ± 2.3 1.5 ± 0.6 1.0 ± 0.4 3.05 17 0.6085 4303 ± 8 66 ± 8 9.9 ± 2.3 1.7 ± 0.5 0.9 ± 0.3 2.96 18 0.7099 4317 ± 6 47 ± 6 13.3 ± 2.7 0.5 ± 0.2 0.6 ± 0.2 2.95 19 0.8114 4331 ± 8 45 ± 7 10.8 ± 2.9 0.6 ± 0.3 0.2 ± 0.1 3.50 20 0.9128 4390 ± 31 169 ± 29 5.7 ± 3.1 3.2 ± 1.9 1.6 ± 1.1 3.42

Table 6—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 0: X-Offset 0.0^{′′}

1 -1.0142 4425 ± 41 164 ± 38 7.2 ± 4.0 2.5 ± 1.6 0.4 ± 0.5 2.62 4 -0.7099 4336 ± 10 75 ± 10 10.5 ± 3.1 1.9 ± 0.7 0.8 ± 0.4 2.41 5 -0.6085 4353 ± 10 96 ± 10 13.4 ± 3.1 1.9 ± 0.5 1.4 ± 0.4 2.58 6 -0.5071 4345 ± 18 163 ± 17 22.8 ± 4.5 1.2 ± 0.3 1.0 ± 0.3 2.81 7 -0.4057 4391 ± 22 178 ± 18 22.4 ± 4.7 1.0 ± 0.3 1.7 ± 0.4 2.86 8 -0.3043 4331 ± 39 223 ± 31 17.3 ± 4.9 1.4 ± 0.5 1.6 ± 0.6 2.78 9 -0.2028 4551 ± 15 274 ± 12 54.9 ± 6.3 2.3 ± 0.3 2.1 ± 0.3 2.61 10 -0.1014 4560 ± 10 444 ± 9 205.9 ± 13.8 3.2 ± 0.2 2.0 ± 0.2 3.16 11 0.0000 4481 ± 7 437 ± 6 316.4 ± 16.3 3.5 ± 0.2 1.8 ± 0.1 3.89 12 0.1014 4308 ± 5 178 ± 4 74.1 ± 5.0 2.5 ± 0.2 1.6 ± 0.1 2.87 13 0.2028 4339 ± 10 135 ± 9 16.0 ± 3.4 2.2 ± 0.6 3.4 ± 0.8 2.33 14 0.3043 4323 ± 12 109 ± 11 10.1 ± 3.0 2.1 ± 0.8 3.5 ± 1.2 2.67 15 0.4057 4336 ± 9 51 ± 8 11.2 ± 3.0 0.9 ± 0.4 0.3 ± 0.2 2.50 16 0.5071 4288 ± 26 159 ± 25 17.0 ± 4.4 1.0 ± 0.4 0.9 ± 0.4 2.88 17 0.6085 4314 ± 25 137 ± 24 7.9 ± 3.3 2.4 ± 1.2 1.9 ± 1.0 2.97 18 0.7099 4331 ± 15 80 ± 16 11.4 ± 3.6 1.0 ± 0.5 0.3 ± 0.2 2.90 20 0.9128 4110 ± 28 158 ± 24 11.4 ± 3.5 0.1 ± 0.3 2.3 ± 0.9 2.96 21 1.0142 4483 ± 39 200 ± 33 8.7 ± 3.8 3.0 ± 1.5 0.7 ± 0.6 2.86

Table 6—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) Slit 2: X-Offset +0.2^{′′}

1 -1.0142 4366 ± 10 75 ± 9 11.1 ± 2.7 1.4 ± 0.4 0.4 ± 0.2 3.19 2 -0.9128 4380 ± 10 80 ± 10 8.5 ± 2.4 1.8 ± 0.6 1.1 ± 0.4 3.07 7 -0.4057 4450 ± 13 101 ± 13 4.6 ± 2.5 3.5 ± 2.0 3.7 ± 2.1 2.81 8 -0.3043 4466 ± 9 84 ± 9 4.2 ± 2.2 4.2 ± 2.3 5.0 ± 2.7 2.91 9 -0.2028 4449 ± 11 91 ± 11 6.7 ± 2.4 2.1 ± 0.9 3.0 ± 1.2 2.83 10 -0.1014 4453 ± 7 84 ± 7 9.6 ± 2.6 3.3 ± 1.0 1.8 ± 0.6 2.91 11 0.0000 4433 ± 7 87 ± 7 9.3 ± 2.6 3.8 ± 1.2 2.4 ± 0.7 2.78 12 0.1014 4385 ± 7 77 ± 7 10.8 ± 2.5 2.5 ± 0.7 1.4 ± 0.4 2.67 13 0.2028 4386 ± 14 131 ± 15 5.2 ± 2.7 6.5 ± 3.5 1.9 ± 1.1 2.56 14 0.3043 4411 ± 8 61 ± 8 8.3 ± 2.3 1.7 ± 0.6 1.3 ± 0.5 2.61 15 0.4057 4421 ± 20 107 ± 19 10.6 ± 3.5 1.1 ± 0.5 0.9 ± 0.4 2.66 16 0.5071 4342 ± 22 83 ± 23 6.1 ± 2.8 1.1 ± 0.7 1.1 ± 0.7 2.77 17 0.6085 4413 ± 44 114 ± 44 3.7 ± 2.8 2.2 ± 2.0 0.4 ± 0.7 2.96 21 1.0142 4112 ± 35 130 ± 34 5.6 ± 2.8 0.1 ± 0.4 2.0 ± 1.2 3.34

Table 7. NGC 315: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.1^{′′}

1 -0.5071 4827 ± 22 70 ± 21 39.1 ± 17.8 0.0 ± 0.3 0.5 ± 0.4 1.67 7 -0.2028 4884 ± 34 161 ± 31 52.2 ± 19.8 1.2 ± 0.6 1.2 ± 0.6 1.90 8 -0.1521 4943 ± 33 175 ± 29 33.0 ± 17.3 3.0 ± 1.7 2.7 ± 1.6 1.93 9 -0.1014 4866 ± 32 193 ± 27 62.0 ± 19.8 2.4 ± 0.9 1.0 ± 0.4 1.65 10 -0.0507 4905 ± 37 272 ± 32 88.4 ± 25.3 2.4 ± 0.8 0.9 ± 0.4 1.84 11 0.0000 4917 ± 28 302 ± 24 151.2 ± 29.4 2.5 ± 0.6 1.3 ± 0.3 1.83 12 0.0507 4814 ± 48 485 ± 44 60.7 ± 45.0 8.3 ± 6.3 3.0 ± 2.3 1.90 13 0.1014 4882 ± 36 337 ± 35 61.7 ± 28.1 5.4 ± 2.6 2.2 ± 1.1 1.88 14 0.1521 5041 ± 8 65 ± 8 55.6 ± 13.8 1.6 ± 0.5 0.9 ± 0.3 1.64 15 0.2028 5036 ± 14 66 ± 13 42.2 ± 15.7 1.3 ± 0.6 0.5 ± 0.3 1.51 16 0.2535 5079 ± 17 79 ± 17 45.6 ± 17.0 1.2 ± 0.6 0.5 ± 0.3 1.45 17 0.3043 5069 ± 12 59 ± 11 65.0 ± 19.4 0.1 ± 0.2 0.6 ± 0.3 1.68 18 0.3550 5053 ± 8 43 ± 7 25.4 ± 9.9 0.5 ± 0.4 2.1 ± 1.0 1.46 20 0.4564 5283 ± 11 42 ± 11 18.7 ± 10.4 0.4 ± 0.5 1.6 ± 1.1 1.28

Slit 0: X-Offset 0.0^{′′}

1 -0.5071 4880 ± 43 174 ± 40 58.9 ± 22.8 0.9 ± 0.5 0.7 ± 0.4 1.36 2 -0.4564 4800 ± 31 160 ± 29 98.9 ± 26.6 0.7 ± 0.3 0.1 ± 0.2 1.65

Table 7—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

4 -0.3550 4860 ± 38 166 ± 36 63.5 ± 22.0 1.2 ± 0.6 0.4 ± 0.3 1.55 5 -0.3043 4853 ± 30 183 ± 27 96.9 ± 23.9 1.1 ± 0.4 0.6 ± 0.3 1.47 6 -0.2535 4878 ± 26 206 ± 22 90.1 ± 21.7 1.8 ± 0.5 1.5 ± 0.4 1.62 7 -0.2028 4915 ± 18 162 ± 16 72.1 ± 17.8 2.0 ± 0.6 2.1 ± 0.6 1.63 8 -0.1521 4921 ± 26 263 ± 19 228.1 ± 29.8 1.3 ± 0.2 0.9 ± 0.2 1.38 9 -0.1014 4873 ± 19 347 ± 16 442.4 ± 43.7 2.1 ± 0.2 0.9 ± 0.1 1.79 10 -0.0507 4824 ± 9 354 ± 8 992.3 ± 53.0 2.2 ± 0.1 1.1 ± 0.1 2.39 11 0.0000 4835 ± 9 528 ± 7 899.0 ± 108.2 7.1 ± 0.9 1.8 ± 0.2 3.84 12 0.0507 4906 ± 9 457 ± 8 1314.6 ± 83.9 3.6 ± 0.2 0.9 ± 0.1 2.94 13 0.1014 4819 ± 28 438 ± 26 479.8 ± 62.2 1.9 ± 0.3 0.7 ± 0.1 1.89 14 0.1521 5124 ± 22 204 ± 18 156.1 ± 26.6 1.3 ± 0.3 0.8 ± 0.2 1.37 15 0.2028 5172 ± 33 172 ± 29 81.8 ± 22.6 0.9 ± 0.4 0.9 ± 0.4 1.74 17 0.3043 4957 ± 38 213 ± 29 117.9 ± 25.8 0.8 ± 0.3 0.7 ± 0.2 1.84 19 0.4057 5218 ± 14 60 ± 14 47.4 ± 16.3 0.7 ± 0.4 0.4 ± 0.3 1.49 20 0.4564 5060 ± 24 102 ± 24 60.6 ± 20.9 0.0 ± 0.2 0.6 ± 0.3 1.58 21 0.5071 5185 ± 8 39 ± 8 15.8 ± 8.5 1.1 ± 0.9 2.8 ± 1.7 1.78

Slit 2: X-Offset +0.1^{′′}

3 -0.4057 4971 ± 26 164 ± 24 97.2 ± 22.4 0.8 ± 0.3 0.3 ± 0.2 1.60 4 -0.3550 4889 ± 22 154 ± 20 72.4 ± 17.4 1.2 ± 0.4 1.2 ± 0.4 1.67 5 -0.3043 4868 ± 18 169 ± 16 66.0 ± 16.7 2.5 ± 0.7 1.8 ± 0.5 1.67

Table 7—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

6 -0.2535 4977 ± 12 136 ± 11 61.9 ± 14.8 3.0 ± 0.8 1.8 ± 0.5 1.83 7 -0.2028 4956 ± 16 222 ± 13 143.8 ± 20.6 2.1 ± 0.4 1.4 ± 0.3 1.69 8 -0.1521 4944 ± 11 208 ± 9 145.5 ± 18.8 3.2 ± 0.5 2.0 ± 0.3 1.56 9 -0.1014 4897 ± 7 214 ± 5 320.3 ± 22.0 2.6 ± 0.2 1.5 ± 0.1 1.96 10 -0.0507 4880 ± 5 239 ± 4 597.9 ± 27.9 2.8 ± 0.2 1.4 ± 0.1 1.99 11 0.0000 4883 ± 4 251 ± 3 712.0 ± 30.2 3.2 ± 0.2 1.4 ± 0.1 1.90 12 0.0507 4953 ± 6 263 ± 4 657.0 ± 31.9 3.0 ± 0.2 1.2 ± 0.1 2.04 13 0.1014 4984 ± 8 242 ± 6 378.2 ± 26.5 2.9 ± 0.2 1.1 ± 0.1 2.30 14 0.1521 5021 ± 17 244 ± 13 198.5 ± 24.1 2.3 ± 0.3 1.2 ± 0.2 1.54 15 0.2028 5014 ± 43 273 ± 33 136.9 ± 28.1 1.2 ± 0.3 0.9 ± 0.3 1.68 17 0.3043 5097 ± 35 191 ± 30 49.1 ± 17.4 2.3 ± 1.0 1.0 ± 0.5 1.70 18 0.3550 5165 ± 45 190 ± 40 65.0 ± 21.8 0.8 ± 0.4 0.7 ± 0.4 1.94 19 0.4057 5256 ± 40 218 ± 31 108.3 ± 26.6 0.9 ± 0.3 0.4 ± 0.2 1.56 20 0.4564 5313 ± 50 222 ± 45 97.2 ± 30.9 0.4 ± 0.3 0.5 ± 0.3 1.71 21 0.5071 5169 ± 41 190 ± 35 63.9 ± 20.5 1.6 ± 0.7 0.1 ± 0.3 1.76

Table 8. NGC 383: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.1^{′′}

2 -0.4564 4953 ± 7 37 ± 7 9.5 ± 5.5 3.4 ± 2.2 3.6 ± 2.4 1.40 3 -0.4057 4880 ± 21 105 ± 21 21.6 ± 10.0 2.4 ± 1.3 1.6 ± 1.1 1.58 4 -0.3550 4923 ± 41 184 ± 38 29.1 ± 13.5 2.4 ± 1.3 0.1 ± 0.7 1.62 5 -0.3043 4915 ± 30 163 ± 28 42.5 ± 14.2 1.9 ± 0.8 0.1 ± 0.4 1.86 6 -0.2535 4952 ± 24 201 ± 20 95.3 ± 17.3 1.3 ± 0.3 0.6 ± 0.3 1.91 7 -0.2028 4945 ± 18 205 ± 15 116.8 ± 16.9 1.5 ± 0.3 1.1 ± 0.3 1.48 8 -0.1521 4957 ± 13 173 ± 11 112.3 ± 14.9 1.7 ± 0.3 1.0 ± 0.2 1.68 9 -0.1014 5046 ± 16 248 ± 12 156.8 ± 18.2 2.1 ± 0.3 0.9 ± 0.2 1.64 10 -0.0507 5086 ± 11 269 ± 9 235.4 ± 20.0 2.6 ± 0.3 1.3 ± 0.2 1.65 11 0.0000 5135 ± 7 235 ± 5 274.4 ± 18.7 3.1 ± 0.2 1.3 ± 0.1 1.90 12 0.0507 5186 ± 7 223 ± 5 275.3 ± 18.6 2.7 ± 0.2 1.0 ± 0.1 2.04 13 0.1014 5201 ± 13 239 ± 10 157.2 ± 17.6 2.6 ± 0.3 1.0 ± 0.2 1.48 14 0.1521 5263 ± 40 306 ± 35 64.9 ± 20.0 3.1 ± 1.1 0.5 ± 0.5 1.34 17 0.3043 5166 ± 40 126 ± 40 31.0 ± 14.3 0.8 ± 0.6 0.6 ± 0.7 1.76 18 0.3550 5216 ± 25 87 ± 25 26.6 ± 11.7 0.3 ± 0.3 1.6 ± 1.0 1.58 20 0.4564 4457 ± 30 137 ± 29 40.8 ± 14.6 1.2 ± 0.6 0.4 ± 0.5 1.60 21 0.5071 5285 ± 7 37 ± 7 33.6 ± 9.2 0.4 ± 0.2 0.5 ± 0.3 1.70

Slit 0: X-Offset 0.0^{′′}

Table 8—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

1 -0.5071 4909 ± 19 94 ± 19 55.7 ± 18.5 0.8 ± 0.4 0.3 ± 0.3 1.68 2 -0.4564 4750 ± 33 140 ± 32 49.6 ± 18.0 1.0 ± 0.5 0.5 ± 0.5 1.68 3 -0.4057 4796 ± 16 93 ± 15 57.9 ± 15.5 1.0 ± 0.4 0.8 ± 0.4 1.72 4 -0.3550 4905 ± 41 212 ± 33 70.8 ± 21.1 1.4 ± 0.5 0.2 ± 0.4 1.71 5 -0.3043 4987 ± 24 149 ± 23 59.9 ± 17.9 1.6 ± 0.6 0.2 ± 0.4 1.56 6 -0.2535 4873 ± 24 213 ± 23 36.6 ± 16.8 5.0 ± 2.4 2.4 ± 1.4 1.76 7 -0.2028 4865 ± 11 182 ± 10 140.6 ± 18.8 2.2 ± 0.4 0.6 ± 0.2 1.89 8 -0.1521 4874 ± 15 319 ± 14 263.4 ± 29.6 2.7 ± 0.3 1.0 ± 0.2 2.08 9 -0.1014 4939 ± 16 464 ± 15 501.0 ± 54.0 3.1 ± 0.4 1.1 ± 0.2 2.17 10 -0.0507 4924 ± 21 798 ± 13 359.0 ± 186.5 13.3 ± 6.9 3.8 ± 2.0 2.99 11 0.0000 5266 ± 44 924 ± 28 5274.1 ± 587.9 0.6 ± 0.1 0.3 ± 0.1 2.68 13 0.1014 5258 ± 16 311 ± 15 181.2 ± 28.0 3.1 ± 0.5 0.7 ± 0.2 1.83 14 0.1521 5299 ± 29 288 ± 29 40.4 ± 22.6 5.9 ± 3.4 0.4 ± 0.8 1.80 15 0.2028 5188 ± 27 159 ± 26 46.7 ± 18.3 2.1 ± 0.9 0.2 ± 0.5 1.69 18 0.3550 4537 ± 57 265 ± 44 67.6 ± 22.3 1.7 ± 0.7 0.5 ± 0.5 1.47 19 0.4057 5193 ± 24 135 ± 24 58.6 ± 18.6 1.2 ± 0.5 0.4 ± 0.4 1.53 20 0.4564 5239 ± 22 108 ± 21 23.9 ± 13.3 2.8 ± 1.7 0.6 ± 0.9 1.76 21 0.5071 5069 ± 11 38 ± 10 22.4 ± 10.1 0.5 ± 0.4 1.5 ± 1.0 1.36

Slit 2: X-Offset +0.1^{′′}

Table 8—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) 1 -0.5071 4871 ± 8 39 ± 7 45.1 ± 13.5 0.4 ± 0.2 0.2 ± 0.2 1.48 2 -0.4564 4865 ± 18 89 ± 18 38.1 ± 12.8 1.4 ± 0.6 0.2 ± 0.4 1.74 4 -0.3550 4855 ± 12 54 ± 12 26.0 ± 10.1 1.5 ± 0.8 0.1 ± 0.5 2.26 5 -0.3043 4813 ± 16 79 ± 16 48.2 ± 15.6 0.7 ± 0.4 0.4 ± 0.3 1.77 6 -0.2535 4777 ± 8 64 ± 8 53.1 ± 11.6 1.3 ± 0.4 0.6 ± 0.3 1.97 7 -0.2028 4813 ± 8 105 ± 8 40.0 ± 10.5 5.2 ± 1.5 1.4 ± 0.6 1.79 8 -0.1521 4857 ± 9 145 ± 9 98.8 ± 14.3 2.6 ± 0.5 1.2 ± 0.3 1.91 9 -0.1014 4922 ± 20 289 ± 17 203.9 ± 24.9 2.0 ± 0.3 1.1 ± 0.2 1.67 10 -0.0507 4967 ± 11 257 ± 8 333.5 ± 25.0 2.0 ± 0.2 0.6 ± 0.1 1.76 11 0.0000 5083 ± 22 406 ± 21 290.3 ± 38.2 2.4 ± 0.4 0.9 ± 0.2 1.53 12 0.0507 5169 ± 35 420 ± 34 245.2 ± 42.5 1.8 ± 0.4 0.7 ± 0.2 1.82 13 0.1014 5229 ± 19 190 ± 18 69.8 ± 16.8 2.6 ± 0.7 0.8 ± 0.4 1.65 18 0.3550 4761 ± 16 64 ± 15 34.8 ± 12.3 0.0 ± 0.3 0.9 ± 0.6 1.75 19 0.4057 5278 ± 23 82 ± 23 15.8 ± 10.7 2.4 ± 1.9 1.4 ± 1.5 1.66 20 0.4564 5122 ± 47 179 ± 43 28.2 ± 15.5 2.2 ± 1.4 1.5 ± 1.3 1.84 21 0.5071 5260 ± 11 59 ± 11 40.4 ± 12.3 1.0 ± 0.4 0.1 ± 0.3 1.81

Table 9. NGC 541: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

2 -0.9128 5600 ± 41 188 ± 35 11.4 ± 4.5 1.6 ± 0.8 1.1 ± 0.6 2.73 5 -0.6085 5516 ± 4 51 ± 4 29.4 ± 4.0 0.4 ± 0.1 0.2 ± 0.1 3.11 6 -0.5071 5528 ± 6 60 ± 6 26.7 ± 4.1 0.5 ± 0.2 0.2 ± 0.1 3.27 7 -0.4057 5535 ± 7 54 ± 6 21.5 ± 3.9 0.7 ± 0.2 0.4 ± 0.1 2.86 8 -0.3043 5195 ± 7 43 ± 7 3.2 ± 1.8 4.5 ± 2.8 1.9 ± 1.3 2.36 9 -0.2028 5220 ± 23 142 ± 22 4.7 ± 3.2 5.6 ± 4.1 4.3 ± 3.1 2.66 10 -0.1014 5297 ± 19 140 ± 18 11.6 ± 4.1 2.8 ± 1.1 1.2 ± 0.6 2.34 11 0.0000 5389 ± 15 168 ± 14 17.6 ± 4.3 4.1 ± 1.1 0.0 ± 0.2 2.61 12 0.1014 5451 ± 8 63 ± 8 4.4 ± 2.3 6.6 ± 3.6 2.6 ± 1.5 2.57 13 0.2028 5442 ± 13 107 ± 14 13.6 ± 3.5 2.4 ± 0.8 0.7 ± 0.3 2.34 14 0.3043 5419 ± 5 104 ± 5 38.3 ± 3.8 1.8 ± 0.2 1.1 ± 0.2 2.85 15 0.4057 5401 ± 4 66 ± 4 34.2 ± 3.8 0.8 ± 0.1 0.7 ± 0.1 2.70 16 0.5071 5390 ± 6 63 ± 6 22.6 ± 3.5 0.9 ± 0.2 0.2 ± 0.1 3.38 17 0.6085 5379 ± 11 80 ± 11 11.4 ± 2.9 1.2 ± 0.4 1.3 ± 0.4 3.38 18 0.7099 5403 ± 11 69 ± 11 9.0 ± 2.7 1.3 ± 0.5 1.1 ± 0.5 2.57 19 0.8114 5497 ± 20 77 ± 21 5.4 ± 2.6 1.4 ± 0.9 1.1 ± 0.8 2.49 20 0.9128 5742 ± 21 47 ± 20 5.1 ± 3.0 0.0 ± 0.3 0.4 ± 0.5 3.00

Slit 0: X-Offset 0.0^{′′}

Table 9—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

5 -0.6085 5485 ± 7 45 ± 6 17.6 ± 3.7 0.3 ± 0.1 0.2 ± 0.1 2.10 6 -0.5071 5498 ± 5 43 ± 4 25.2 ± 4.1 0.1 ± 0.1 0.1 ± 0.1 2.59 7 -0.4057 5471 ± 5 29 ± 4 13.4 ± 3.0 0.6 ± 0.2 0.1 ± 0.1 2.98 9 -0.2028 5406 ± 24 163 ± 22 13.0 ± 4.3 2.2 ± 0.9 2.1 ± 0.8 2.26 10 -0.1014 5597 ± 23 362 ± 21 78.5 ± 11.2 2.6 ± 0.4 1.0 ± 0.2 2.78 11 0.0000 5459 ± 16 336 ± 13 138.3 ± 11.7 2.0 ± 0.2 0.4 ± 0.1 2.44 12 0.1014 5402 ± 23 164 ± 21 21.6 ± 5.2 1.7 ± 0.5 0.3 ± 0.2 2.54 13 0.2028 5331 ± 8 38 ± 8 8.7 ± 2.8 0.7 ± 0.3 0.7 ± 0.4 2.60 14 0.3043 5377 ± 8 55 ± 7 14.5 ± 3.2 0.9 ± 0.3 0.6 ± 0.2 2.73 15 0.4057 5372 ± 3 36 ± 3 26.1 ± 3.5 0.4 ± 0.1 0.3 ± 0.1 2.54 16 0.5071 5360 ± 8 77 ± 8 27.2 ± 4.4 0.3 ± 0.1 0.5 ± 0.1 2.51 17 0.6085 5250 ± 32 117 ± 31 4.5 ± 2.9 0.7 ± 0.8 3.1 ± 2.3 2.28 20 0.9128 5411 ± 14 47 ± 14 5.5 ± 2.6 0.1 ± 0.3 0.9 ± 0.7 2.62

Slit 2: X-Offset +0.2^{′′}

1 -1.0142 5503 ± 24 84 ± 22 8.2 ± 3.4 0.8 ± 0.5 0.5 ± 0.4 3.02 2 -0.9128 5039 ± 38 160 ± 36 8.9 ± 3.7 0.2 ± 0.3 1.4 ± 0.8 2.87 6 -0.5071 5484 ± 8 73 ± 8 20.5 ± 3.6 0.5 ± 0.2 0.6 ± 0.2 3.47 7 -0.4057 5382 ± 11 107 ± 11 33.3 ± 5.0 0.2 ± 0.1 0.4 ± 0.1 3.15 8 -0.3043 5428 ± 11 108 ± 11 27.5 ± 4.5 0.9 ± 0.2 0.2 ± 0.1 2.56

Table 9—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

9 -0.2028 5383 ± 9 68 ± 8 14.0 ± 3.1 1.2 ± 0.4 0.9 ± 0.3 2.62 10 -0.1014 5371 ± 17 110 ± 17 16.4 ± 4.0 0.9 ± 0.3 1.0 ± 0.3 2.34 11 0.0000 5410 ± 20 106 ± 20 19.5 ± 5.4 0.1 ± 0.2 0.6 ± 0.2 2.79 12 0.1014 5292 ± 17 117 ± 17 19.6 ± 4.5 1.1 ± 0.3 0.2 ± 0.2 2.62 13 0.2028 5312 ± 3 27 ± 4 16.1 ± 3.8 0.5 ± 0.2 0.3 ± 0.1 2.63 14 0.3043 5324 ± 5 49 ± 5 20.2 ± 3.4 0.5 ± 0.1 0.3 ± 0.1 2.89 15 0.4057 5330 ± 6 55 ± 5 19.9 ± 3.1 0.5 ± 0.1 0.5 ± 0.1 2.85 16 0.5071 5346 ± 6 54 ± 5 22.0 ± 3.5 0.2 ± 0.1 0.3 ± 0.1 2.85 17 0.6085 5343 ± 6 42 ± 6 12.9 ± 2.9 0.1 ± 0.1 0.4 ± 0.2 2.60 19 0.8114 5275 ± 20 75 ± 19 9.2 ± 3.3 0.0 ± 0.2 0.4 ± 0.3 2.60 20 0.9128 4453 ± 26 144 ± 24 11.4 ± 3.0 0.1 ± 0.2 1.4 ± 0.5 2.37

Table 10. NGC 741: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

2 -0.9128 5337 ± 33 86 ± 31 5.6 ± 3.5 0.0 ± 0.3 1.2 ± 0.9 2.41 3 -0.8114 5309 ± 28 125 ± 28 15.0 ± 5.3 0.1 ± 0.2 0.6 ± 0.3 2.69 6 -0.5071 5303 ± 32 190 ± 29 7.1 ± 4.2 4.1 ± 2.6 1.3 ± 1.0 3.00 7 -0.4057 5465 ± 23 100 ± 22 7.5 ± 3.8 1.8 ± 1.1 0.8 ± 0.6 3.08 12 0.1014 5686 ± 20 138 ± 19 11.9 ± 3.9 1.7 ± 0.7 1.9 ± 0.7 2.83 13 0.2028 5616 ± 41 192 ± 37 9.5 ± 4.7 2.4 ± 1.4 0.6 ± 0.5 3.50 18 0.7099 5252 ± 42 181 ± 41 9.6 ± 4.2 0.1 ± 0.3 1.5 ± 0.8 3.33 19 0.8114 5317 ± 10 37 ± 10 10.5 ± 3.9 0.3 ± 0.2 0.0 ± 0.1 2.94

Slit 0: X-Offset 0.0^{′′}

2 -0.9128 5091 ± 54 168 ± 49 13.7 ± 6.4 0.7 ± 0.5 0.5 ± 0.4 2.12 6 -0.5071 5164 ± 0 3 ± 0 0.1 ± 0.0 2.4 ± 0.0 0.4 ± 2.1 2.45 11 0.0000 5706 ± 26 424 ± 24 57.2 ± 14.4 4.2 ± 1.1 1.8 ± 0.5 2.40 12 0.1014 5882 ± 52 361 ± 47 25.8 ± 10.3 2.8 ± 1.2 1.3 ± 0.7 2.22 13 0.2028 5163 ± 28 96 ± 28 7.6 ± 4.1 0.7 ± 0.6 1.5 ± 1.0 2.15

Slit 2: X-Offset +0.2^{′′}

Table 10—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) 10 -0.1014 5559 ± 32 96 ± 30 12.1 ± 5.8 0.4 ± 0.4 0.3 ± 0.3 2.40 11 0.0000 5608 ± 21 122 ± 20 22.4 ± 6.3 0.7 ± 0.3 0.3 ± 0.2 2.92 14 0.3043 5171 ± 10 61 ± 10 4.2 ± 2.3 0.9 ± 0.7 3.5 ± 2.1 2.63

Table 11. UGC 01841: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

1 -1.0142 6626 ± 13 87 ± 13 10.6 ± 2.6 1.0 ± 0.3 0.4 ± 0.2 4.21 2 -0.9128 6276 ± 27 172 ± 25 5.5 ± 2.4 3.5 ± 1.7 1.3 ± 0.9 4.16 5 -0.6085 6444 ± 7 60 ± 7 13.1 ± 2.6 0.8 ± 0.2 0.3 ± 0.2 4.90 6 -0.5071 6258 ± 47 289 ± 35 22.2 ± 4.6 1.0 ± 0.3 1.1 ± 0.3 4.45 7 -0.4057 6416 ± 9 115 ± 9 6.9 ± 2.1 4.6 ± 1.5 1.5 ± 0.6 4.76 8 -0.3043 6411 ± 7 137 ± 7 9.3 ± 2.2 5.8 ± 1.5 2.9 ± 0.8 4.34 9 -0.2028 6379 ± 13 234 ± 10 48.3 ± 4.0 1.5 ± 0.2 0.5 ± 0.1 3.53 10 -0.1014 6155 ± 29 574 ± 25 28.0 ± 11.2 7.2 ± 2.9 3.0 ± 1.3 4.58 11 0.0000 6228 ± 10 316 ± 8 85.7 ± 5.9 2.5 ± 0.2 1.0 ± 0.1 4.20 12 0.1014 6305 ± 8 212 ± 7 38.8 ± 3.5 2.5 ± 0.3 1.1 ± 0.2 4.32 13 0.2028 6088 ± 47 426 ± 47 12.8 ± 5.8 4.4 ± 2.1 0.6 ± 0.6 4.56 14 0.3043 6369 ± 36 155 ± 32 4.1 ± 2.4 3.2 ± 2.0 0.3 ± 0.9 4.48 15 0.4057 6458 ± 24 95 ± 23 3.4 ± 2.0 1.7 ± 1.2 2.3 ± 1.7 5.04 16 0.5071 6725 ± 19 57 ± 19 5.2 ± 2.4 0.4 ± 0.3 0.4 ± 0.4 3.89 17 0.6085 6433 ± 32 125 ± 32 3.2 ± 2.0 2.7 ± 2.0 0.9 ± 1.1 5.27 19 0.8114 6617 ± 20 84 ± 20 9.2 ± 3.8 0.4 ± 0.3 0.1 ± 0.3 3.96 20 0.9128 6320 ± 22 112 ± 21 4.8 ± 1.9 2.3 ± 1.1 1.1 ± 0.7 4.76

Slit 0: X-Offset 0.0^{′′}

Table 11—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

3 -0.8114 6350 ± 12 68 ± 11 4.0 ± 2.2 3.9 ± 2.4 0.4 ± 0.7 3.40 4 -0.7099 6339 ± 23 125 ± 23 14.1 ± 4.2 1.1 ± 0.4 0.5 ± 0.3 2.62 6 -0.5071 6276 ± 21 169 ± 19 9.2 ± 3.6 4.4 ± 1.9 1.1 ± 0.7 2.43 7 -0.4057 6371 ± 15 163 ± 14 16.3 ± 3.8 3.0 ± 0.8 0.1 ± 0.3 3.18 8 -0.3043 6428 ± 10 164 ± 10 22.8 ± 3.9 3.2 ± 0.6 0.9 ± 0.3 3.83 9 -0.2028 6329 ± 10 278 ± 8 110.7 ± 7.2 1.9 ± 0.2 1.1 ± 0.1 3.44 10 -0.1014 6337 ± 7 596 ± 6 215.6 ± 26.7 9.1 ± 1.1 3.2 ± 0.4 4.16 11 0.0000 6305 ± 5 592 ± 4 1001.2 ± 37.8 3.0 ± 0.1 1.1 ± 0.1 4.79 13 0.2028 6322 ± 26 260 ± 21 26.3 ± 5.2 2.2 ± 0.5 0.3 ± 0.2 3.46 14 0.3043 6126 ± 27 176 ± 26 5.2 ± 3.3 5.2 ± 3.5 2.8 ± 2.1 2.94 15 0.4057 6451 ± 31 105 ± 31 5.1 ± 3.0 1.6 ± 1.1 1.6 ± 1.2 3.10 17 0.6085 6407 ± 36 104 ± 33 10.6 ± 4.8 0.2 ± 0.2 0.5 ± 0.4 3.84

Slit 2: X-Offset +0.2^{′′}

1 -1.0142 6449 ± 35 172 ± 33 7.7 ± 3.1 2.0 ± 1.0 0.7 ± 0.6 4.02 3 -0.8114 6303 ± 12 109 ± 12 4.6 ± 2.1 4.8 ± 2.3 3.8 ± 1.9 3.60 6 -0.5071 6394 ± 10 85 ± 10 12.3 ± 2.7 1.5 ± 0.4 0.9 ± 0.3 3.62 7 -0.4057 6393 ± 5 72 ± 4 7.1 ± 1.9 5.2 ± 1.5 1.3 ± 0.5 3.12 8 -0.3043 6412 ± 5 111 ± 5 17.2 ± 2.6 3.9 ± 0.6 0.9 ± 0.3 3.54 9 -0.2028 6388 ± 5 120 ± 5 25.7 ± 3.1 2.4 ± 0.3 1.6 ± 0.3 4.25

Table 11—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

10 -0.1014 6390 ± 6 166 ± 6 42.1 ± 3.7 2.2 ± 0.2 1.5 ± 0.2 3.76 11 0.0000 6363 ± 6 150 ± 6 46.0 ± 3.8 1.5 ± 0.2 1.1 ± 0.1 3.04 12 0.1014 6415 ± 10 165 ± 9 21.3 ± 3.4 2.8 ± 0.5 1.1 ± 0.3 4.05 14 0.3043 6328 ± 20 123 ± 20 7.3 ± 2.6 2.4 ± 1.0 0.5 ± 0.6 4.44 17 0.6085 6204 ± 14 79 ± 14 6.7 ± 2.3 1.8 ± 0.8 0.1 ± 0.5 3.44 18 0.7099 6450 ± 44 268 ± 39 7.3 ± 3.6 3.6 ± 1.9 1.0 ± 0.9 3.65 20 0.9128 6391 ± 27 120 ± 27 7.7 ± 2.9 0.0 ± 0.2 1.9 ± 1.0 3.41 21 1.0142 6118 ± 7 45 ± 7 9.7 ± 2.3 0.4 ± 0.2 0.5 ± 0.3 3.95

Table 12. NGC 2329: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

2 -0.9128 6017 ± 7 52 ± 7 13.0 ± 2.6 0.4 ± 0.1 0.3 ± 0.2 3.27 3 -0.8114 5709 ± 49 164 ± 48 4.6 ± 2.7 1.7 ± 1.2 1.7 ± 1.4 2.73 4 -0.7099 5752 ± 52 284 ± 40 28.8 ± 5.7 0.4 ± 0.2 0.2 ± 0.2 3.24 5 -0.6085 5973 ± 10 67 ± 11 8.9 ± 2.3 1.2 ± 0.4 0.5 ± 0.3 3.19 6 -0.5071 5989 ± 13 59 ± 12 8.8 ± 3.1 0.5 ± 0.3 0.8 ± 0.4 2.98 7 -0.4057 5493 ± 26 112 ± 26 7.4 ± 2.7 1.2 ± 0.6 0.6 ± 0.5 3.33 8 -0.3043 5816 ± 39 223 ± 30 12.7 ± 3.8 2.1 ± 0.7 0.2 ± 0.4 3.04 9 -0.2028 5810 ± 20 154 ± 20 9.5 ± 3.2 3.3 ± 1.3 0.2 ± 0.5 2.53 10 -0.1014 5763 ± 13 133 ± 13 16.6 ± 3.6 2.3 ± 0.6 0.7 ± 0.4 2.67 11 0.0000 5747 ± 13 150 ± 12 16.0 ± 3.2 3.4 ± 0.8 0.5 ± 0.4 2.51 12 0.1014 5775 ± 19 201 ± 16 25.0 ± 4.0 1.8 ± 0.4 0.1 ± 0.2 2.94 13 0.2028 5855 ± 26 170 ± 22 9.4 ± 3.0 2.7 ± 1.0 0.9 ± 0.6 2.90 14 0.3043 5678 ± 8 29 ± 7 2.8 ± 1.2 1.6 ± 0.9 1.0 ± 0.9 3.03 18 0.7099 5748 ± 32 137 ± 31 6.4 ± 2.6 1.6 ± 0.8 0.6 ± 0.7 3.22

Slit 0: X-Offset 0.0^{′′}

1 -1.0142 5898 ± 23 74 ± 23 3.7 ± 2.6 2.2 ± 1.8 2.0 ± 2.0 1.93 5 -0.6085 6063 ± 10 38 ± 11 5.3 ± 2.5 1.2 ± 0.8 0.4 ± 0.6 2.34

Table 12—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

6 -0.5071 5877 ± 28 129 ± 28 11.8 ± 4.2 0.1 ± 0.3 1.9 ± 0.9 2.50 7 -0.4057 5943 ± 12 79 ± 11 11.8 ± 3.3 1.8 ± 0.7 1.1 ± 0.5 2.20 9 -0.2028 5819 ± 9 104 ± 9 20.5 ± 4.3 2.6 ± 0.6 1.7 ± 0.5 2.17 10 -0.1014 5795 ± 5 268 ± 5 96.0 ± 9.6 6.6 ± 0.7 2.2 ± 0.3 3.19 11 0.0000 5789 ± 4 301 ± 4 348.6 ± 13.8 3.0 ± 0.1 1.1 ± 0.1 3.82 12 0.1014 5735 ± 2 61 ± 2 30.4 ± 4.1 3.7 ± 0.6 0.1 ± 0.2 4.66 14 0.3043 5627 ± 16 76 ± 16 13.3 ± 4.5 0.7 ± 0.4 0.3 ± 0.4 2.64 20 0.9128 5782 ± 45 146 ± 43 12.2 ± 5.1 0.6 ± 0.4 0.2 ± 0.5 2.23 21 1.0142 5770 ± 38 111 ± 37 4.1 ± 3.0 2.5 ± 2.1 0.6 ± 1.4 2.25

Slit 2: X-Offset +0.2^{′′}

1 -1.0142 5643 ± 37 154 ± 35 8.9 ± 3.4 1.4 ± 0.7 0.5 ± 0.6 2.15 2 -0.9128 5560 ± 7 32 ± 10 6.7 ± 2.9 0.4 ± 0.3 0.4 ± 0.4 2.48 8 -0.3043 5905 ± 5 53 ± 5 21.3 ± 3.3 0.5 ± 0.1 0.7 ± 0.2 2.64 9 -0.2028 5830 ± 21 195 ± 20 11.6 ± 3.8 3.9 ± 1.4 1.2 ± 0.7 2.69 10 -0.1014 5875 ± 9 119 ± 9 25.0 ± 3.8 1.9 ± 0.4 0.1 ± 0.2 2.94 11 0.0000 5844 ± 10 123 ± 10 24.2 ± 4.0 1.8 ± 0.4 1.0 ± 0.3 2.44 12 0.1014 5839 ± 6 82 ± 6 20.7 ± 3.3 1.8 ± 0.4 0.6 ± 0.2 2.66 13 0.2028 5742 ± 12 77 ± 12 12.5 ± 3.1 1.1 ± 0.4 0.5 ± 0.3 2.25 14 0.3043 5700 ± 8 45 ± 8 10.9 ± 2.9 0.7 ± 0.3 0.2 ± 0.3 2.58 15 0.4057 5631 ± 10 39 ± 9 6.5 ± 2.4 0.5 ± 0.3 0.3 ± 0.4 2.59

Table 12—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

17 0.6085 5774 ± 30 157 ± 29 4.8 ± 2.8 4.0 ± 2.5 0.5 ± 1.1 2.71 19 0.8114 5841 ± 20 60 ± 20 5.3 ± 2.7 0.6 ± 0.5 0.9 ± 0.8 2.43 20 0.9128 5742 ± 13 59 ± 13 5.4 ± 2.2 1.6 ± 0.8 0.5 ± 0.7 2.61

Table 13. NGC 2892: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

1 -1.0142 6843 ± 8 25 ± 6 1.4 ± 0.9 1.1 ± 0.9 4.9 ± 3.6 3.48 3 -0.8114 6649 ± 13 76 ± 12 15.2 ± 3.6 0.1 ± 0.1 0.4 ± 0.2 3.31 4 -0.7099 6895 ± 22 143 ± 22 7.9 ± 2.5 1.8 ± 0.7 1.2 ± 0.7 3.43 6 -0.5071 6700 ± 20 71 ± 20 3.1 ± 1.9 2.0 ± 1.5 0.6 ± 1.0 3.25 8 -0.3043 6905 ± 14 81 ± 13 10.1 ± 2.7 0.9 ± 0.3 0.3 ± 0.3 3.19 9 -0.2028 6912 ± 23 71 ± 23 5.7 ± 2.7 0.5 ± 0.4 1.0 ± 0.7 3.18 11 0.0000 6844 ± 9 98 ± 9 10.4 ± 2.7 2.5 ± 0.7 0.5 ± 0.4 3.17 12 0.1014 6868 ± 12 99 ± 12 3.9 ± 2.9 5.8 ± 4.4 2.5 ± 2.1 2.98 13 0.2028 6935 ± 9 85 ± 10 3.6 ± 2.1 5.5 ± 3.4 3.6 ± 2.4 2.94 15 0.4057 6856 ± 8 35 ± 7 3.0 ± 1.4 1.8 ± 1.0 1.7 ± 1.3 2.95 16 0.5071 6891 ± 4 36 ± 3 8.0 ± 1.7 1.5 ± 0.4 0.3 ± 0.3 2.74 19 0.8114 6674 ± 22 71 ± 22 6.7 ± 2.8 0.0 ± 0.2 0.4 ± 0.4 3.38 21 1.0142 6931 ± 13 31 ± 13 3.4 ± 2.0 0.2 ± 0.3 0.1 ± 0.5 3.43

Slit 0: X-Offset 0.0^{′′}

1 -1.0142 6734 ± 46 157 ± 44 5.8 ± 3.7 2.1 ± 1.6 1.2 ± 1.2 2.11 3 -0.8114 6665 ± 27 66 ± 26 7.1 ± 3.9 0.2 ± 0.3 0.5 ± 0.6 2.21 9 -0.2028 6962 ± 24 206 ± 21 26.6 ± 5.4 1.5 ± 0.4 0.1 ± 0.3 2.25

Table 13—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

10 -0.1014 6844 ± 19 354 ± 18 28.1 ± 7.8 5.9 ± 1.7 1.4 ± 0.5 2.24 11 0.0000 6938 ± 7 453 ± 6 240.9 ± 17.0 4.3 ± 0.3 1.1 ± 0.1 2.44 12 0.1014 6947 ± 10 452 ± 9 259.5 ± 17.3 2.8 ± 0.2 0.5 ± 0.1 2.96 21 1.0142 6956 ± 33 81 ± 34 4.1 ± 2.9 1.5 ± 1.6 0.3 ± 1.1 1.98

Slit 2: X-Offset +0.2^{′′}

3 -0.8114 6894 ± 28 65 ± 26 4.3 ± 2.7 0.0 ± 0.4 1.7 ± 1.4 2.70 4 -0.7099 7218 ± 44 147 ± 43 3.8 ± 2.9 3.0 ± 2.6 0.1 ± 1.2 1.70 5 -0.6085 6902 ± 34 134 ± 31 15.9 ± 5.5 0.0 ± 0.1 0.2 ± 0.3 2.70 7 -0.4057 6801 ± 21 92 ± 21 7.4 ± 3.0 1.5 ± 0.8 0.3 ± 0.6 2.44 10 -0.1014 6963 ± 43 260 ± 37 11.0 ± 4.7 2.9 ± 1.4 1.2 ± 0.9 2.22 11 0.0000 6840 ± 13 169 ± 12 38.5 ± 5.1 1.1 ± 0.2 0.2 ± 0.2 2.62 12 0.1014 6890 ± 10 138 ± 9 16.2 ± 3.3 3.2 ± 0.7 0.7 ± 0.4 2.52 13 0.2028 6957 ± 17 183 ± 17 5.8 ± 3.3 7.7 ± 4.6 1.0 ± 1.3 2.55 14 0.3043 6938 ± 26 135 ± 26 5.8 ± 3.0 2.9 ± 1.7 0.4 ± 0.9 2.42 15 0.4057 6899 ± 26 54 ± 25 4.3 ± 2.9 0.5 ± 0.6 0.4 ± 0.8 2.46 16 0.5071 6980 ± 38 213 ± 32 9.4 ± 4.0 2.6 ± 1.3 0.8 ± 0.8 2.17 17 0.6085 7064 ± 8 42 ± 8 3.2 ± 1.7 3.4 ± 2.0 0.4 ± 0.9 2.46

Table 14. NGC 3801: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

2 -0.9128 3372 ± 40 89 ± 40 3.7 ± 2.2 0.0 ± 0.3 0.2 ± 0.6 3.00 3 -0.8114 3436 ± 16 57 ± 16 4.3 ± 1.7 0.4 ± 0.3 0.4 ± 0.5 3.49 4 -0.7099 3468 ± 9 46 ± 9 3.4 ± 1.2 1.0 ± 0.5 1.7 ± 0.9 3.59 7 -0.4057 3476 ± 9 48 ± 9 1.5 ± 1.0 1.0 ± 0.9 7.5 ± 5.2 3.41 9 -0.2028 3325 ± 13 161 ± 12 25.4 ± 3.3 0.9 ± 0.2 0.8 ± 0.2 3.78 10 -0.1014 3383 ± 10 143 ± 9 20.8 ± 2.9 1.7 ± 0.3 0.8 ± 0.2 3.66 11 0.0000 3378 ± 12 142 ± 11 15.6 ± 2.8 1.9 ± 0.4 1.3 ± 0.3 3.01 12 0.1014 3345 ± 17 148 ± 17 14.5 ± 2.9 1.0 ± 0.3 1.1 ± 0.4 3.50 14 0.3043 3471 ± 16 74 ± 17 2.5 ± 1.5 3.1 ± 2.2 2.1 ± 1.7 3.23 17 0.6085 3317 ± 26 113 ± 24 8.0 ± 2.7 1.0 ± 0.5 0.3 ± 0.4 3.53 20 0.9128 3190 ± 19 56 ± 20 2.9 ± 1.6 0.9 ± 0.7 0.9 ± 0.9 3.17

Slit 0: X-Offset 0.0^{′′}

2 -0.9128 3510 ± 26 124 ± 26 6.3 ± 2.5 1.7 ± 0.8 1.4 ± 0.8 2.76 3 -0.8114 3461 ± 17 57 ± 17 3.4 ± 1.8 1.2 ± 0.8 1.4 ± 1.2 2.43 6 -0.5071 3448 ± 18 157 ± 17 11.5 ± 2.8 2.5 ± 0.7 0.3 ± 0.4 2.51 8 -0.3043 3438 ± 12 75 ± 12 4.7 ± 2.0 2.6 ± 1.3 2.5 ± 1.3 2.02 9 -0.2028 3486 ± 12 146 ± 12 16.0 ± 3.0 2.1 ± 0.5 1.6 ± 0.4 2.55

Table 14—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

10 -0.1014 3510 ± 12 174 ± 11 25.0 ± 3.7 2.0 ± 0.4 1.1 ± 0.3 2.56 11 0.0000 3498 ± 12 163 ± 12 25.8 ± 4.1 1.8 ± 0.4 1.1 ± 0.3 2.32 12 0.1014 3451 ± 14 129 ± 14 9.9 ± 3.1 3.1 ± 1.1 2.3 ± 0.9 2.72 13 0.2028 3397 ± 20 125 ± 20 10.8 ± 3.3 1.5 ± 0.6 1.1 ± 0.6 2.27 14 0.3043 3425 ± 31 208 ± 26 22.9 ± 4.7 0.9 ± 0.3 0.2 ± 0.3 2.20 17 0.6085 2822 ± 37 205 ± 36 21.4 ± 5.4 0.1 ± 0.1 0.7 ± 0.3 2.57 19 0.8114 3194 ± 28 108 ± 28 9.7 ± 3.5 0.1 ± 0.2 0.7 ± 0.5 2.43 20 0.9128 3184 ± 38 164 ± 38 13.8 ± 4.3 0.1 ± 0.2 0.5 ± 0.4 2.71 21 1.0142 3263 ± 47 180 ± 44 11.2 ± 4.1 0.5 ± 0.3 0.8 ± 0.5 2.66

Slit 2: X-Offset +0.2^{′′}

2 -0.9128 3405 ± 17 53 ± 17 3.5 ± 1.7 0.7 ± 0.5 0.8 ± 0.7 2.96 3 -0.8114 3455 ± 15 47 ± 15 3.7 ± 1.6 0.6 ± 0.4 0.1 ± 0.4 2.64 4 -0.7099 3506 ± 10 39 ± 10 1.3 ± 0.9 3.4 ± 2.7 1.9 ± 1.9 2.44 5 -0.6085 3388 ± 16 67 ± 16 3.5 ± 1.6 0.1 ± 0.3 2.5 ± 1.4 2.43 7 -0.4057 3447 ± 19 119 ± 19 8.6 ± 2.4 0.5 ± 0.2 2.4 ± 0.8 2.75 8 -0.3043 3456 ± 11 102 ± 10 15.3 ± 2.9 0.7 ± 0.2 1.3 ± 0.3 2.62 9 -0.2028 3522 ± 12 93 ± 12 6.4 ± 1.9 2.1 ± 0.7 2.1 ± 0.8 2.93 10 -0.1014 3640 ± 17 138 ± 17 11.2 ± 2.6 1.0 ± 0.3 2.1 ± 0.6 2.70 11 0.0000 3611 ± 18 140 ± 18 8.7 ± 2.4 1.4 ± 0.5 2.8 ± 0.9 2.98 12 0.1014 3518 ± 19 121 ± 19 7.2 ± 2.3 1.1 ± 0.5 2.9 ± 1.1 2.93

Table 14—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

13 0.2028 3441 ± 8 38 ± 8 5.9 ± 1.9 0.5 ± 0.3 0.6 ± 0.4 2.52 14 0.3043 3456 ± 9 63 ± 9 10.1 ± 2.2 0.5 ± 0.2 0.9 ± 0.4 2.43 15 0.4057 3451 ± 9 59 ± 9 7.8 ± 1.9 0.8 ± 0.3 1.5 ± 0.5 2.31 20 0.9128 3482 ± 18 99 ± 19 4.7 ± 1.8 1.8 ± 0.8 2.0 ± 1.0 2.90

Table 15. NGC 3862: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

1 -1.0142 6244 ± 13 48 ± 13 9.5 ± 4.4 0.6 ± 0.4 1.1 ± 0.8 2.10 5 -0.6085 6452 ± 9 56 ± 8 23.3 ± 5.4 0.4 ± 0.2 0.1 ± 0.2 2.22 6 -0.5071 6464 ± 5 43 ± 5 20.7 ± 4.2 0.7 ± 0.2 1.0 ± 0.3 1.94 7 -0.4057 6450 ± 5 43 ± 4 34.1 ± 5.5 0.2 ± 0.1 0.1 ± 0.1 2.25 8 -0.3043 6451 ± 9 78 ± 9 23.7 ± 4.9 1.3 ± 0.4 0.4 ± 0.3 2.07 9 -0.2028 6457 ± 8 80 ± 8 20.3 ± 4.9 2.0 ± 0.6 0.7 ± 0.4 2.30 10 -0.1014 6486 ± 13 149 ± 13 10.2 ± 5.1 7.7 ± 4.0 1.9 ± 1.4 2.36 11 0.0000 6468 ± 13 214 ± 12 42.7 ± 7.7 3.1 ± 0.6 1.2 ± 0.4 2.41 12 0.1014 6408 ± 9 87 ± 9 29.0 ± 5.4 1.3 ± 0.3 0.7 ± 0.3 2.36 13 0.2028 6438 ± 8 77 ± 8 32.2 ± 5.6 0.8 ± 0.2 0.3 ± 0.2 2.26 14 0.3043 6455 ± 5 47 ± 5 29.4 ± 4.9 0.2 ± 0.1 0.9 ± 0.3 2.27 15 0.4057 6460 ± 7 51 ± 7 21.1 ± 4.7 0.7 ± 0.2 0.4 ± 0.3 1.96 16 0.5071 6472 ± 6 38 ± 6 13.9 ± 3.9 0.8 ± 0.3 0.7 ± 0.4 2.10 17 0.6085 6478 ± 10 49 ± 9 10.8 ± 3.7 1.2 ± 0.5 0.4 ± 0.5 2.31 18 0.7099 6573 ± 18 66 ± 18 10.2 ± 4.5 0.9 ± 0.6 1.1 ± 0.8 1.95 21 1.0142 6463 ± 10 40 ± 10 5.6 ± 2.9 0.0 ± 0.4 3.3 ± 2.2 2.23

Slit 0: X-Offset 0.0^{′′}

Table 15—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) 4 -0.7099 6525 ± 19 50 ± 19 7.6 ± 4.7 1.0 ± 0.9 0.5 ± 0.9 1.75 5 -0.6085 6510 ± 7 38 ± 8 17.5 ± 5.4 0.4 ± 0.2 0.6 ± 0.4 1.70 6 -0.5071 6503 ± 7 43 ± 7 10.1 ± 3.7 2.1 ± 0.9 1.1 ± 0.7 1.82 7 -0.4057 6512 ± 7 52 ± 6 21.3 ± 5.0 1.3 ± 0.4 0.3 ± 0.3 1.81 8 -0.3043 6520 ± 7 52 ± 7 14.0 ± 4.3 1.9 ± 0.7 1.4 ± 0.7 1.88 9 -0.2028 6520 ± 10 116 ± 10 39.4 ± 7.4 1.8 ± 0.4 0.2 ± 0.2 2.34 10 -0.1014 6605 ± 6 267 ± 6 84.9 ± 13.8 9.4 ± 1.6 3.7 ± 0.7 3.40 11 0.0000 6441 ± 4 302 ± 3 854.0 ± 25.6 2.4 ± 0.1 1.0 ± 0.1 4.21 12 0.1014 6474 ± 6 197 ± 6 18.8 ± 8.2 17.9 ± 7.8 0.7 ± 0.8 4.59 13 0.2028 6487 ± 15 147 ± 15 11.5 ± 5.8 6.2 ± 3.3 0.1 ± 0.9 2.01 14 0.3043 6526 ± 6 49 ± 6 20.9 ± 4.8 1.1 ± 0.3 0.6 ± 0.3 1.90 16 0.5071 6603 ± 44 199 ± 37 20.5 ± 7.9 1.5 ± 0.7 0.0 ± 0.5 1.96 17 0.6085 6511 ± 28 95 ± 28 10.6 ± 5.8 1.4 ± 1.0 0.4 ± 0.7 1.76

Slit 2: X-Offset +0.2^{′′}

1 -1.0142 6364 ± 50 235 ± 40 14.1 ± 5.9 2.1 ± 1.0 0.4 ± 0.6 1.90 3 -0.8114 6480 ± 14 51 ± 13 5.6 ± 3.2 1.8 ± 1.2 0.9 ± 0.9 2.27 4 -0.7099 6526 ± 5 40 ± 5 5.6 ± 2.3 3.7 ± 1.7 1.8 ± 1.0 2.43 5 -0.6085 6536 ± 7 46 ± 7 12.8 ± 3.5 1.1 ± 0.4 0.1 ± 0.3 2.27 6 -0.5071 6541 ± 8 65 ± 8 18.3 ± 4.1 1.2 ± 0.3 0.3 ± 0.3 2.32 7 -0.4057 6527 ± 5 74 ± 5 12.7 ± 3.5 3.8 ± 1.1 0.8 ± 0.5 2.81

Table 15—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

8 -0.3043 6554 ± 7 77 ± 7 16.0 ± 3.6 2.2 ± 0.6 1.3 ± 0.5 2.32 9 -0.2028 6551 ± 14 149 ± 14 15.1 ± 4.7 3.6 ± 1.2 1.1 ± 0.6 2.33 10 -0.1014 6625 ± 9 102 ± 8 13.9 ± 3.8 3.5 ± 1.1 2.5 ± 0.9 2.61 11 0.0000 6603 ± 10 118 ± 9 28.3 ± 5.1 2.0 ± 0.4 0.5 ± 0.3 1.99 12 0.1014 6581 ± 20 214 ± 18 26.8 ± 5.8 2.5 ± 0.6 1.1 ± 0.5 2.45 13 0.2028 6435 ± 34 235 ± 29 23.6 ± 6.3 1.8 ± 0.6 0.7 ± 0.4 2.06 14 0.3043 6450 ± 64 263 ± 49 26.0 ± 7.9 0.9 ± 0.4 0.5 ± 0.4 2.12 15 0.4057 6568 ± 6 46 ± 5 23.8 ± 4.4 0.5 ± 0.1 0.2 ± 0.2 1.99 16 0.5071 6530 ± 7 55 ± 7 15.6 ± 3.5 1.0 ± 0.3 1.3 ± 0.5 2.44

Table 16. UGC 7115: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 0: X-Offset 0.0^{′′}

5 -0.6085 6792 ± 17 63 ± 18 5.7 ± 2.7 1.0 ± 0.7 0.6 ± 0.5 2.59 6 -0.5071 6886 ± 9 49 ± 8 8.4 ± 2.5 1.0 ± 0.4 0.5 ± 0.3 2.90 7 -0.4057 6863 ± 6 57 ± 6 15.8 ± 3.0 0.8 ± 0.2 0.7 ± 0.2 2.65 8 -0.3043 6897 ± 7 64 ± 7 15.1 ± 2.9 1.2 ± 0.3 0.6 ± 0.2 2.84 9 -0.2028 6914 ± 9 107 ± 9 17.1 ± 3.8 2.3 ± 0.6 0.9 ± 0.3 2.53 10 -0.1014 6963 ± 10 271 ± 9 74.7 ± 6.9 2.6 ± 0.3 1.1 ± 0.1 2.48 11 0.0000 6801 ± 9 496 ± 7 372.8 ± 19.3 2.4 ± 0.1 1.4 ± 0.1 2.79 12 0.1014 6625 ± 13 545 ± 10 138.7 ± 20.7 5.6 ± 0.8 2.3 ± 0.4 3.86 13 0.2028 6669 ± 8 224 ± 7 62.4 ± 5.0 2.3 ± 0.2 0.9 ± 0.1 2.92 15 0.4057 6639 ± 8 69 ± 8 3.1 ± 1.9 5.6 ± 3.7 4.7 ± 3.1 2.78 16 0.5071 6661 ± 5 40 ± 6 5.7 ± 1.8 1.9 ± 0.7 0.7 ± 0.4 2.42

Table 17. NGC 4261: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.1^{′′}

1 -0.5071 2442 ± 17 126 ± 16 77.3 ± 19.6 1.6 ± 0.5 1.0 ± 0.4 1.62 2 -0.4564 2324 ± 17 149 ± 17 68.2 ± 18.7 2.3 ± 0.7 1.2 ± 0.5 1.62 3 -0.4057 2388 ± 14 114 ± 13 43.0 ± 15.6 3.3 ± 1.3 1.8 ± 0.8 1.54 4 -0.3550 2365 ± 16 186 ± 15 94.8 ± 20.8 2.7 ± 0.7 1.5 ± 0.4 1.45 5 -0.3043 2357 ± 11 193 ± 10 174.7 ± 23.0 2.5 ± 0.4 0.7 ± 0.2 1.83 6 -0.2535 2377 ± 7 195 ± 6 223.3 ± 23.1 3.3 ± 0.4 1.4 ± 0.2 1.64 7 -0.2028 2393 ± 6 237 ± 5 381.4 ± 27.7 3.4 ± 0.3 1.4 ± 0.1 1.91 8 -0.1521 2360 ± 7 343 ± 7 864.7 ± 48.2 2.8 ± 0.2 1.0 ± 0.1 2.24 9 -0.1014 2216 ± 7 463 ± 6 948.5 ± 69.4 5.0 ± 0.4 1.7 ± 0.1 1.96 10 -0.0507 2079 ± 7 461 ± 6 936.9 ± 69.3 5.0 ± 0.4 1.6 ± 0.1 2.17 11 0.0000 2038 ± 11 459 ± 10 491.7 ± 57.1 5.1 ± 0.6 1.4 ± 0.2 1.68 12 0.0507 2071 ± 20 406 ± 19 263.9 ± 43.1 3.5 ± 0.6 1.1 ± 0.2 1.85 13 0.1014 2099 ± 35 341 ± 32 84.0 ± 30.4 4.3 ± 1.6 1.7 ± 0.7 1.59 14 0.1521 2187 ± 29 239 ± 24 62.6 ± 21.5 3.7 ± 1.4 1.4 ± 0.7 1.68 18 0.3550 2142 ± 22 123 ± 22 52.5 ± 17.3 1.5 ± 0.6 0.9 ± 0.5 1.90 20 0.4564 2020 ± 34 119 ± 34 35.0 ± 16.8 1.5 ± 1.0 0.1 ± 0.5 1.50 21 0.5071 2021 ± 22 99 ± 22 45.1 ± 16.2 1.3 ± 0.6 0.1 ± 0.3 1.73

Slit 0: X-Offset 0.0^{′′}

Table 17—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

1 -0.5071 2327 ± 27 112 ± 26 33.6 ± 17.5 2.3 ± 1.4 0.4 ± 0.5 1.93 2 -0.4564 2283 ± 22 155 ± 21 51.3 ± 18.9 3.0 ± 1.3 0.7 ± 0.5 1.89 3 -0.4057 2274 ± 20 152 ± 18 46.9 ± 18.1 3.1 ± 1.3 2.6 ± 1.1 1.33 4 -0.3550 2216 ± 13 141 ± 12 71.3 ± 18.5 3.2 ± 0.9 1.8 ± 0.6 1.64 5 -0.3043 2233 ± 14 164 ± 13 84.7 ± 19.9 2.7 ± 0.7 2.2 ± 0.6 1.77 6 -0.2535 2249 ± 18 191 ± 15 125.0 ± 23.4 2.2 ± 0.5 0.4 ± 0.2 2.05 7 -0.2028 2280 ± 12 139 ± 12 118.2 ± 20.7 1.8 ± 0.4 0.5 ± 0.2 1.71 8 -0.1521 2243 ± 13 189 ± 11 161.9 ± 23.5 2.1 ± 0.4 1.0 ± 0.2 1.77 9 -0.1014 2210 ± 11 182 ± 10 83.5 ± 19.1 5.0 ± 1.2 2.8 ± 0.7 1.72 10 -0.0507 2194 ± 11 205 ± 10 91.9 ± 21.1 5.6 ± 1.4 2.4 ± 0.6 1.98 11 0.0000 2140 ± 18 290 ± 17 70.1 ± 25.7 8.2 ± 3.1 4.3 ± 1.7 1.71 12 0.0507 2184 ± 14 194 ± 12 68.1 ± 20.3 4.9 ± 1.5 3.6 ± 1.1 1.67 13 0.1014 2189 ± 15 147 ± 16 40.8 ± 16.1 5.0 ± 2.1 1.8 ± 0.9 1.58 14 0.1521 2156 ± 11 79 ± 11 41.0 ± 13.1 2.6 ± 1.0 1.3 ± 0.6 1.79 15 0.2028 2212 ± 15 84 ± 15 33.1 ± 13.8 2.2 ± 1.1 1.7 ± 0.9 1.86

Slit 2: X-Offset +0.1^{′′}

1 -0.5071 2341 ± 18 116 ± 17 73.2 ± 20.6 1.6 ± 0.6 0.3 ± 0.3 1.74 2 -0.4564 2300 ± 17 135 ± 17 76.0 ± 20.4 2.1 ± 0.7 0.4 ± 0.3 1.54 3 -0.4057 2261 ± 17 131 ± 16 79.8 ± 20.2 2.0 ± 0.6 0.5 ± 0.3 1.44

Table 17—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

4 -0.3550 2212 ± 22 214 ± 18 127.7 ± 25.1 2.1 ± 0.5 0.9 ± 0.3 1.61 5 -0.3043 2228 ± 20 163 ± 18 57.2 ± 19.1 3.1 ± 1.2 2.0 ± 0.8 1.83 6 -0.2535 2317 ± 15 110 ± 15 63.7 ± 18.3 1.7 ± 0.6 1.4 ± 0.5 1.52 7 -0.2028 2308 ± 15 83 ± 15 31.6 ± 14.8 2.7 ± 1.5 1.2 ± 0.8 1.54 8 -0.1521 2244 ± 22 167 ± 20 85.7 ± 21.9 1.9 ± 0.6 1.0 ± 0.4 1.52 9 -0.1014 2271 ± 12 144 ± 11 73.4 ± 17.9 3.3 ± 0.9 2.1 ± 0.6 1.59 10 -0.0507 2223 ± 9 125 ± 8 97.9 ± 18.0 2.8 ± 0.6 1.5 ± 0.4 1.33 11 0.0000 2243 ± 11 139 ± 11 93.6 ± 18.9 2.9 ± 0.7 1.3 ± 0.3 1.48 12 0.0507 2251 ± 9 103 ± 9 37.2 ± 16.5 6.0 ± 2.8 2.4 ± 1.2 1.94 13 0.1014 2199 ± 19 170 ± 18 26.7 ± 19.0 8.4 ± 6.1 3.6 ± 2.7 1.39 15 0.2028 1984 ± 49 251 ± 38 49.4 ± 21.9 3.1 ± 1.5 2.4 ± 1.2 1.63 16 0.2535 2091 ± 34 161 ± 31 66.0 ± 21.6 1.1 ± 0.5 1.0 ± 0.5 1.63 20 0.4564 2022 ± 24 90 ± 24 21.6 ± 14.0 2.3 ± 1.8 1.6 ± 1.3 1.60

Table 18. NGC 4335: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

1 -1.0142 4955 ± 12 94 ± 12 5.4 ± 1.6 2.3 ± 0.8 0.8 ± 0.5 2.80 3 -0.8114 4943 ± 7 92 ± 7 13.0 ± 1.9 1.8 ± 0.3 0.8 ± 0.3 2.81 4 -0.7099 4915 ± 9 107 ± 9 14.3 ± 2.2 1.7 ± 0.3 1.0 ± 0.3 2.37 5 -0.6085 4928 ± 7 84 ± 7 8.5 ± 1.9 2.9 ± 0.7 1.3 ± 0.5 2.29 6 -0.5071 4967 ± 6 83 ± 6 13.7 ± 2.2 2.0 ± 0.4 0.3 ± 0.2 2.15 7 -0.4057 4947 ± 5 85 ± 5 20.8 ± 2.6 1.7 ± 0.3 0.8 ± 0.2 1.84 8 -0.3043 4904 ± 8 111 ± 8 19.2 ± 3.1 2.2 ± 0.4 1.0 ± 0.3 2.20 9 -0.2028 4807 ± 10 160 ± 9 29.5 ± 4.0 2.3 ± 0.4 1.0 ± 0.3 2.43 10 -0.1014 4711 ± 7 174 ± 6 41.4 ± 4.4 2.8 ± 0.3 0.5 ± 0.2 2.06 11 0.0000 4639 ± 5 163 ± 5 45.9 ± 4.2 3.1 ± 0.3 0.9 ± 0.2 2.34 12 0.1014 4606 ± 6 158 ± 6 36.3 ± 3.9 3.0 ± 0.4 0.6 ± 0.2 2.14 13 0.2028 4540 ± 6 109 ± 6 15.5 ± 3.0 3.4 ± 0.7 0.4 ± 0.3 2.50 14 0.3043 4507 ± 6 83 ± 6 6.1 ± 2.3 5.4 ± 2.1 1.0 ± 0.7 3.17 16 0.5071 4471 ± 10 100 ± 10 8.3 ± 2.0 2.4 ± 0.7 0.7 ± 0.4 2.72 17 0.6085 4416 ± 29 227 ± 25 9.4 ± 2.9 2.4 ± 0.8 0.7 ± 0.5 2.99 18 0.7099 4476 ± 18 129 ± 18 9.0 ± 2.3 1.3 ± 0.4 1.0 ± 0.4 3.24 20 0.9128 4526 ± 17 97 ± 18 7.0 ± 2.1 1.0 ± 0.4 0.5 ± 0.4 3.04 21 1.0142 4531 ± 21 138 ± 22 6.3 ± 2.0 1.2 ± 0.5 1.7 ± 0.7 3.68

Table 18—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) Slit 0: X-Offset 0.0^{′′}

1 -1.0142 4940 ± 11 80 ± 11 9.7 ± 2.5 1.4 ± 0.5 0.8 ± 0.4 2.16 2 -0.9128 4928 ± 8 70 ± 8 7.0 ± 2.1 2.5 ± 0.9 1.5 ± 0.7 2.21 3 -0.8114 4912 ± 6 60 ± 6 15.7 ± 2.7 1.1 ± 0.2 1.0 ± 0.3 2.18 4 -0.7099 4910 ± 5 55 ± 5 17.8 ± 2.8 0.9 ± 0.2 0.8 ± 0.2 2.31 5 -0.6085 4906 ± 7 61 ± 7 17.0 ± 3.1 0.9 ± 0.2 0.9 ± 0.3 2.01 6 -0.5071 4890 ± 22 170 ± 21 12.9 ± 4.2 2.7 ± 1.0 1.7 ± 0.8 1.88 7 -0.4057 4865 ± 20 207 ± 19 12.8 ± 4.8 4.7 ± 1.9 1.7 ± 1.0 1.62 8 -0.3043 4800 ± 10 133 ± 10 27.1 ± 4.9 2.4 ± 0.5 1.1 ± 0.4 1.66 9 -0.2028 4749 ± 8 162 ± 7 42.6 ± 5.8 3.0 ± 0.5 1.7 ± 0.3 1.56 10 -0.1014 4683 ± 4 210 ± 3 155.9 ± 8.1 3.0 ± 0.2 1.3 ± 0.1 2.19 11 0.0000 4619 ± 3 248 ± 2 337.3 ± 10.3 2.6 ± 0.1 1.0 ± 0.1 3.21 12 0.1014 4568 ± 3 220 ± 3 206.9 ± 8.2 2.7 ± 0.1 1.0 ± 0.1 2.19 13 0.2028 4531 ± 5 134 ± 5 47.9 ± 5.2 3.3 ± 0.4 1.2 ± 0.2 1.72 14 0.3043 4493 ± 8 131 ± 8 28.0 ± 4.7 2.7 ± 0.5 1.1 ± 0.3 1.98 15 0.4057 4376 ± 17 168 ± 17 22.7 ± 5.1 2.0 ± 0.5 0.6 ± 0.3 2.11 16 0.5071 4372 ± 22 175 ± 21 18.7 ± 4.7 2.0 ± 0.6 0.8 ± 0.4 2.39 17 0.6085 4406 ± 17 148 ± 17 17.0 ± 4.0 1.9 ± 0.5 1.1 ± 0.4 2.28 18 0.7099 4383 ± 13 123 ± 14 12.2 ± 3.2 2.2 ± 0.7 1.6 ± 0.6 2.16 19 0.8114 4438 ± 23 159 ± 23 8.8 ± 3.2 2.5 ± 1.1 1.6 ± 0.8 2.54

Table 18—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) Slit 2: X-Offset +0.2^{′′}

1 -1.0142 4683 ± 53 259 ± 49 5.1 ± 3.6 3.2 ± 2.4 3.5 ± 2.8 2.72 4 -0.7099 4883 ± 14 67 ± 14 6.0 ± 2.3 1.5 ± 0.7 0.3 ± 0.5 2.69 5 -0.6085 4767 ± 14 103 ± 15 9.7 ± 2.9 1.9 ± 0.7 1.1 ± 0.6 2.17 7 -0.4057 4725 ± 13 114 ± 12 16.2 ± 4.0 1.8 ± 0.5 0.7 ± 0.4 1.95 8 -0.3043 4713 ± 13 109 ± 12 13.5 ± 3.7 2.2 ± 0.7 1.1 ± 0.5 1.74 9 -0.2028 4673 ± 8 82 ± 8 8.4 ± 3.2 4.4 ± 1.8 1.5 ± 0.9 1.72 10 -0.1014 4654 ± 5 76 ± 5 11.8 ± 3.0 4.3 ± 1.2 1.9 ± 0.7 1.95 11 0.0000 4605 ± 5 83 ± 5 12.2 ± 3.2 4.8 ± 1.3 1.4 ± 0.6 1.74 12 0.1014 4550 ± 5 94 ± 6 13.7 ± 3.4 5.0 ± 1.3 1.4 ± 0.6 1.94 13 0.2028 4509 ± 6 115 ± 6 22.4 ± 3.7 3.7 ± 0.7 0.9 ± 0.3 1.70 14 0.3043 4504 ± 11 145 ± 10 12.6 ± 3.7 4.8 ± 1.5 1.6 ± 0.7 1.85 15 0.4057 4481 ± 19 158 ± 18 13.8 ± 3.9 2.4 ± 0.8 0.8 ± 0.5 1.75 16 0.5071 4329 ± 6 54 ± 6 14.9 ± 2.9 1.0 ± 0.3 0.4 ± 0.2 1.68 17 0.6085 4325 ± 7 58 ± 7 12.0 ± 3.1 1.2 ± 0.4 0.4 ± 0.3 2.24 18 0.7099 4352 ± 14 128 ± 14 5.8 ± 2.6 4.6 ± 2.2 3.4 ± 1.8 2.51 19 0.8114 4345 ± 10 78 ± 10 5.3 ± 2.1 2.9 ± 1.3 1.7 ± 1.0 2.20 21 1.0142 4476 ± 34 152 ± 34 4.3 ± 2.7 2.7 ± 1.9 0.9 ± 1.1 3.22

Table 19. M84 : Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

1 -0.5071 1088 ± 7 89 ± 8 19.3 ± 3.2 1.9 ± 0.4 0.9 ± 0.3 1.33 2 -0.4564 1071 ± 6 88 ± 6 14.4 ± 2.8 3.2 ± 0.7 1.6 ± 0.4 1.28 3 -0.4057 1064 ± 7 95 ± 7 21.7 ± 3.3 2.2 ± 0.4 1.0 ± 0.2 1.36 4 -0.3550 1061 ± 6 101 ± 6 31.6 ± 3.6 1.9 ± 0.3 1.1 ± 0.2 1.22 5 -0.3043 1068 ± 5 118 ± 5 45.4 ± 4.0 1.9 ± 0.2 0.9 ± 0.1 1.34 6 -0.2535 1106 ± 4 126 ± 4 53.1 ± 3.9 2.5 ± 0.2 1.2 ± 0.1 1.39 7 -0.2028 1102 ± 3 115 ± 3 67.7 ± 4.0 2.2 ± 0.2 1.1 ± 0.1 1.42 8 -0.1521 1102 ± 2 102 ± 2 65.0 ± 3.6 2.3 ± 0.2 1.5 ± 0.1 1.54 9 -0.1014 1099 ± 2 124 ± 2 79.8 ± 3.9 2.5 ± 0.1 1.6 ± 0.1 1.50 10 -0.0507 1076 ± 2 137 ± 2 104.9 ± 4.1 2.7 ± 0.1 1.8 ± 0.1 1.65 11 0.0000 1026 ± 2 178 ± 2 150.0 ± 4.9 2.5 ± 0.1 1.8 ± 0.1 1.58 12 0.0507 944 ± 2 197 ± 2 168.1 ± 5.2 2.5 ± 0.1 1.8 ± 0.1 1.61 13 0.1014 878 ± 2 190 ± 2 153.1 ± 5.1 2.7 ± 0.1 1.7 ± 0.1 1.33 14 0.1521 856 ± 3 200 ± 2 131.4 ± 5.0 2.8 ± 0.1 1.8 ± 0.1 1.24 15 0.2028 865 ± 3 184 ± 2 113.5 ± 4.9 2.8 ± 0.1 1.8 ± 0.1 1.23 16 0.2535 855 ± 4 175 ± 3 87.5 ± 4.7 2.5 ± 0.2 1.8 ± 0.1 1.31 17 0.3043 839 ± 5 158 ± 4 56.8 ± 4.3 2.6 ± 0.2 1.9 ± 0.2 1.42 18 0.3550 846 ± 5 141 ± 5 46.2 ± 4.0 2.4 ± 0.2 1.6 ± 0.2 1.33 19 0.4057 881 ± 6 160 ± 6 43.3 ± 4.1 2.5 ± 0.3 1.6 ± 0.2 1.24

Table 19—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

20 0.4564 900 ± 6 143 ± 6 33.0 ± 3.8 3.0 ± 0.4 2.0 ± 0.3 1.34 21 0.5071 913 ± 5 126 ± 5 27.0 ± 3.5 3.2 ± 0.5 2.3 ± 0.4 1.26

Slit 0: X-Offset 0.000^{′′}

1 -0.5071 1148 ± 7 118 ± 7 31.6 ± 3.7 1.4 ± 0.2 1.2 ± 0.2 1.30 2 -0.4564 1156 ± 7 148 ± 7 28.0 ± 3.5 2.3 ± 0.3 1.9 ± 0.3 1.30 3 -0.4057 1202 ± 5 140 ± 5 32.9 ± 3.4 2.4 ± 0.3 1.6 ± 0.2 1.47 4 -0.3550 1224 ± 4 138 ± 4 46.1 ± 3.6 2.1 ± 0.2 1.4 ± 0.1 1.40 5 -0.3043 1238 ± 4 156 ± 3 60.6 ± 3.9 2.3 ± 0.2 1.6 ± 0.1 1.33 6 -0.2535 1269 ± 3 173 ± 3 86.3 ± 4.1 2.3 ± 0.1 1.5 ± 0.1 1.45 7 -0.2028 1322 ± 3 192 ± 2 115.7 ± 4.4 2.6 ± 0.1 1.8 ± 0.1 1.58 8 -0.1521 1376 ± 2 224 ± 2 190.2 ± 5.2 2.7 ± 0.1 1.9 ± 0.1 1.78 9 -0.1014 1420 ± 2 305 ± 2 380.0 ± 8.1 2.6 ± 0.1 1.6 ± 0.0 2.35 10 -0.0507 1383 ± 4 483 ± 3 633.2 ± 20.0 3.2 ± 0.1 1.7 ± 0.1 3.95 11 0.0000 1107 ± 11 883 ± 5 761.1 ± 81.3 4.8 ± 0.5 2.4 ± 0.3 5.07 12 0.0507 751 ± 10 779 ± 5 402.9 ± 60.4 7.3 ± 1.1 3.9 ± 0.6 4.03 13 0.1014 754 ± 4 415 ± 4 377.8 ± 14.0 3.0 ± 0.1 1.9 ± 0.1 2.33 14 0.1521 786 ± 5 319 ± 4 175.4 ± 7.8 2.9 ± 0.1 1.9 ± 0.1 2.12 15 0.2028 869 ± 6 258 ± 5 106.9 ± 6.0 2.4 ± 0.2 1.4 ± 0.1 1.67 16 0.2535 934 ± 5 188 ± 4 74.5 ± 4.9 2.1 ± 0.2 1.2 ± 0.1 1.30 17 0.3043 963 ± 4 141 ± 4 58.2 ± 4.3 1.9 ± 0.2 1.1 ± 0.1 1.36

Table 19—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

18 0.3550 979 ± 3 105 ± 3 37.1 ± 3.5 2.4 ± 0.3 1.3 ± 0.2 1.37 19 0.4057 975 ± 4 101 ± 3 40.0 ± 3.6 2.0 ± 0.2 1.0 ± 0.1 1.37 20 0.4564 960 ± 3 94 ± 3 36.8 ± 3.4 2.0 ± 0.2 1.2 ± 0.2 1.28 21 0.5071 958 ± 3 83 ± 3 33.6 ± 3.3 2.0 ± 0.2 1.2 ± 0.2 1.56

Slit 2: X-Offset +0.2^{′′}

1 -0.5071 1266 ± 6 122 ± 5 38.3 ± 3.7 1.6 ± 0.2 1.2 ± 0.2 1.27 2 -0.4564 1261 ± 5 126 ± 5 34.4 ± 3.5 2.1 ± 0.3 1.4 ± 0.2 1.30 3 -0.4057 1249 ± 5 138 ± 5 34.1 ± 3.5 2.7 ± 0.3 1.3 ± 0.2 1.30 4 -0.3550 1256 ± 5 150 ± 4 34.5 ± 3.6 3.3 ± 0.4 2.2 ± 0.3 1.33 5 -0.3043 1251 ± 4 169 ± 4 49.4 ± 3.9 3.1 ± 0.3 2.0 ± 0.2 1.40 6 -0.2535 1276 ± 4 170 ± 4 61.0 ± 4.1 2.8 ± 0.2 1.6 ± 0.1 1.49 7 -0.2028 1266 ± 3 162 ± 3 71.6 ± 4.2 2.5 ± 0.2 1.4 ± 0.1 1.41 8 -0.1521 1239 ± 3 150 ± 3 79.4 ± 4.3 2.3 ± 0.1 1.3 ± 0.1 1.31 9 -0.1014 1208 ± 3 147 ± 3 71.4 ± 4.4 2.2 ± 0.2 1.4 ± 0.1 1.41 10 -0.0507 1159 ± 4 163 ± 3 59.6 ± 4.6 2.7 ± 0.2 1.7 ± 0.2 1.39 11 0.0000 1126 ± 3 140 ± 3 71.3 ± 4.3 2.1 ± 0.1 1.4 ± 0.1 1.42 12 0.0507 1105 ± 3 136 ± 3 63.5 ± 4.1 2.1 ± 0.2 1.5 ± 0.1 1.28 13 0.1014 1086 ± 4 140 ± 4 54.8 ± 4.1 2.2 ± 0.2 1.1 ± 0.1 1.27 14 0.1521 1060 ± 4 118 ± 4 46.0 ± 3.8 2.1 ± 0.2 1.2 ± 0.1 1.32 15 0.2028 1035 ± 4 111 ± 4 36.1 ± 3.7 2.2 ± 0.3 1.4 ± 0.2 1.22

Table 19—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

16 0.2535 1039 ± 4 102 ± 4 41.1 ± 3.7 1.8 ± 0.2 1.1 ± 0.2 1.40 17 0.3043 1006 ± 4 97 ± 4 45.0 ± 4.1 1.5 ± 0.2 0.7 ± 0.1 1.55 18 0.3550 986 ± 4 96 ± 4 34.2 ± 3.9 1.9 ± 0.3 0.9 ± 0.2 1.36 19 0.4057 980 ± 4 90 ± 4 36.8 ± 4.0 1.4 ± 0.2 0.7 ± 0.1 1.27 20 0.4564 983 ± 4 74 ± 3 36.5 ± 3.7 1.2 ± 0.2 0.7 ± 0.1 1.28 21 0.5071 998 ± 5 90 ± 5 30.3 ± 3.7 1.5 ± 0.2 0.8 ± 0.2 1.28

Table 20. NGC 4486: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

1 -0.5071 1535 ± 14 374 ± 12 113.0 ± 17.5 3.9 ± 0.6 2.4 ± 0.4 1.93 2 -0.4564 1634 ± 12 376 ± 10 252.0 ± 19.7 2.0 ± 0.2 1.4 ± 0.1 2.10 3 -0.4057 1775 ± 5 266 ± 4 353.6 ± 14.4 1.7 ± 0.1 1.3 ± 0.1 2.18 4 -0.3550 1765 ± 4 256 ± 3 352.3 ± 14.1 2.0 ± 0.1 1.4 ± 0.1 1.89 5 -0.3043 1755 ± 5 274 ± 4 332.3 ± 14.4 2.2 ± 0.1 1.5 ± 0.1 1.90 6 -0.2535 1788 ± 3 274 ± 2 477.4 ± 15.6 2.5 ± 0.1 1.6 ± 0.1 2.33 7 -0.2028 1850 ± 2 235 ± 1 794.4 ± 16.2 2.4 ± 0.1 1.5 ± 0.0 2.68 8 -0.1521 1842 ± 1 206 ± 1 1109.7 ± 17.9 2.4 ± 0.0 1.5 ± 0.0 2.81 9 -0.1014 1814 ± 1 191 ± 0 1301.5 ± 18.2 2.3 ± 0.0 1.3 ± 0.0 3.34 10 -0.0507 1789 ± 1 191 ± 1 1101.6 ± 17.5 2.2 ± 0.0 1.2 ± 0.0 3.37 11 0.0000 1720 ± 1 211 ± 1 894.9 ± 17.9 2.0 ± 0.0 1.1 ± 0.0 2.53 12 0.0507 1587 ± 2 251 ± 2 744.3 ± 19.3 1.9 ± 0.1 1.0 ± 0.0 2.89 13 0.1014 1411 ± 3 304 ± 3 611.7 ± 19.7 2.4 ± 0.1 1.3 ± 0.1 2.98 14 0.1521 1287 ± 4 308 ± 3 536.7 ± 18.8 2.6 ± 0.1 1.6 ± 0.1 2.42 15 0.2028 1195 ± 3 259 ± 2 450.5 ± 15.5 2.6 ± 0.1 1.7 ± 0.1 1.83 16 0.2535 1115 ± 2 197 ± 2 423.7 ± 12.7 2.4 ± 0.1 1.6 ± 0.1 2.20 17 0.3043 1106 ± 2 180 ± 2 311.2 ± 11.1 2.7 ± 0.1 1.8 ± 0.1 1.84 18 0.3550 1120 ± 2 171 ± 2 257.4 ± 10.6 2.5 ± 0.1 1.6 ± 0.1 1.69 19 0.4057 1115 ± 3 149 ± 2 193.4 ± 9.6 2.3 ± 0.1 1.6 ± 0.1 1.87

Table 20—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

20 0.4564 1115 ± 3 145 ± 3 139.1 ± 8.8 2.4 ± 0.2 1.8 ± 0.1 1.81 21 0.5071 1112 ± 5 166 ± 5 93.9 ± 8.8 3.2 ± 0.3 1.9 ± 0.2 1.84

Slit 0: X-Offset 0.0^{′′}

1 -0.5071 1451 ± 7 212 ± 6 189.2 ± 14.2 1.8 ± 0.2 1.3 ± 0.1 1.64 2 -0.4564 1469 ± 4 191 ± 4 200.7 ± 13.1 2.4 ± 0.2 1.8 ± 0.1 1.72 3 -0.4057 1497 ± 3 197 ± 2 406.8 ± 15.6 2.1 ± 0.1 1.5 ± 0.1 2.01 4 -0.3550 1521 ± 2 201 ± 2 582.5 ± 17.4 1.9 ± 0.1 1.3 ± 0.0 1.97 5 -0.3043 1532 ± 2 205 ± 2 655.5 ± 17.7 2.1 ± 0.1 1.3 ± 0.0 2.11 6 -0.2535 1526 ± 2 217 ± 1 802.6 ± 19.7 2.1 ± 0.1 1.2 ± 0.0 2.53 7 -0.2028 1548 ± 2 253 ± 2 883.2 ± 22.4 2.2 ± 0.1 1.2 ± 0.0 2.63 8 -0.1521 1525 ± 3 301 ± 2 1378.4 ± 30.7 2.1 ± 0.1 1.0 ± 0.0 3.91 9 -0.1014 1378 ± 3 422 ± 3 2160.2 ± 48.2 2.2 ± 0.1 1.1 ± 0.0 3.38 10 -0.0507 1128 ± 7 681 ± 5 1781.4 ± 108.3 4.3 ± 0.3 1.5 ± 0.1 3.29 11 0.0000 1109 ± 6 612 ± 6 3500.2 ± 102.1 1.8 ± 0.1 0.8 ± 0.0 7.08 12 0.0507 1142 ± 18 920 ± 10 4026.6 ± 258.4 1.2 ± 0.1 0.4 ± 0.0 7.24 13 0.1014 940 ± 8 628 ± 7 1372.2 ± 58.2 2.3 ± 0.1 0.7 ± 0.0 3.91 14 0.1521 948 ± 6 395 ± 5 697.2 ± 26.5 2.5 ± 0.1 1.2 ± 0.1 1.98 15 0.2028 1003 ± 4 277 ± 3 558.2 ± 17.6 2.6 ± 0.1 1.6 ± 0.1 2.13 16 0.2535 1020 ± 2 218 ± 2 622.5 ± 15.2 2.3 ± 0.1 1.5 ± 0.0 2.13 17 0.3043 1007 ± 2 206 ± 2 536.8 ± 13.7 2.3 ± 0.1 1.5 ± 0.0 2.07

Table 20—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

18 0.3550 1000 ± 3 193 ± 2 364.7 ± 11.9 2.3 ± 0.1 1.5 ± 0.1 1.95 19 0.4057 1018 ± 4 190 ± 3 266.5 ± 11.5 2.3 ± 0.1 1.4 ± 0.1 1.70 20 0.4564 1047 ± 3 183 ± 3 258.4 ± 11.1 2.2 ± 0.1 1.3 ± 0.1 1.66 21 0.5071 1073 ± 3 156 ± 3 207.0 ± 10.4 2.4 ± 0.1 1.5 ± 0.1 1.47

Slit 2: X-Offset +0.2^{′′}

1 -0.5071 1083 ± 10 225 ± 8 143.0 ± 12.0 1.7 ± 0.2 1.2 ± 0.1 1.84 2 -0.4564 1088 ± 9 236 ± 7 132.8 ± 12.0 2.3 ± 0.2 1.4 ± 0.2 1.90 3 -0.4057 1089 ± 8 234 ± 6 158.2 ± 12.2 2.1 ± 0.2 1.5 ± 0.1 1.75 4 -0.3550 1053 ± 8 254 ± 7 152.5 ± 12.1 2.4 ± 0.2 1.7 ± 0.2 1.82 5 -0.3043 1019 ± 9 275 ± 8 165.4 ± 12.9 2.5 ± 0.2 1.6 ± 0.2 2.15 6 -0.2535 1008 ± 11 309 ± 9 197.4 ± 15.1 2.4 ± 0.2 1.5 ± 0.2 2.03 7 -0.2028 1026 ± 12 350 ± 10 209.9 ± 17.3 2.5 ± 0.2 1.7 ± 0.2 1.85 8 -0.1521 1029 ± 12 367 ± 10 216.5 ± 18.4 2.8 ± 0.3 1.7 ± 0.2 2.05 9 -0.1014 1038 ± 11 368 ± 9 261.9 ± 19.6 2.5 ± 0.2 1.7 ± 0.2 2.39 10 -0.0507 1038 ± 10 380 ± 8 344.8 ± 21.0 2.3 ± 0.2 1.5 ± 0.1 2.10 11 0.0000 992 ± 10 407 ± 8 364.2 ± 22.6 2.5 ± 0.2 1.6 ± 0.1 2.25 12 0.0507 922 ± 9 395 ± 8 404.9 ± 21.9 2.5 ± 0.2 1.6 ± 0.1 2.23 13 0.1014 869 ± 5 329 ± 5 434.7 ± 18.0 2.8 ± 0.1 1.6 ± 0.1 2.39 14 0.1521 852 ± 4 286 ± 3 499.4 ± 16.4 2.6 ± 0.1 1.4 ± 0.1 2.26 15 0.2028 843 ± 3 239 ± 2 555.4 ± 14.7 2.3 ± 0.1 1.3 ± 0.0 2.16

Table 20—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

16 0.2535 864 ± 3 239 ± 2 520.7 ± 14.1 2.1 ± 0.1 1.3 ± 0.0 2.23 17 0.3043 890 ± 3 231 ± 2 483.9 ± 13.5 2.1 ± 0.1 1.4 ± 0.1 2.22 18 0.3550 893 ± 3 213 ± 2 440.6 ± 12.6 2.1 ± 0.1 1.3 ± 0.1 1.87 19 0.4057 880 ± 3 199 ± 2 364.4 ± 11.5 2.3 ± 0.1 1.4 ± 0.1 1.97 20 0.4564 907 ± 3 199 ± 2 322.5 ± 11.1 2.1 ± 0.1 1.4 ± 0.1 1.79 21 0.5071 940 ± 4 203 ± 3 296.1 ± 11.0 2.2 ± 0.1 1.5 ± 0.1 1.79

Table 21. NGC 5127: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

5 -0.6085 4931 ± 17 52 ± 17 4.4 ± 2.3 0.4 ± 0.5 1.3 ± 0.9 3.61 8 -0.3043 4851 ± 10 125 ± 10 11.4 ± 2.8 2.5 ± 0.7 2.7 ± 0.7 3.72 9 -0.2028 4873 ± 9 91 ± 9 5.4 ± 2.2 4.3 ± 1.9 3.5 ± 1.5 3.01 10 -0.1014 4799 ± 8 61 ± 8 6.7 ± 2.1 1.5 ± 0.6 1.8 ± 0.7 3.31 11 0.0000 4919 ± 22 125 ± 22 7.6 ± 2.9 1.8 ± 0.8 1.2 ± 0.6 2.99 12 0.1014 4711 ± 27 161 ± 26 11.1 ± 3.5 1.4 ± 0.6 1.0 ± 0.4 3.59 13 0.2028 4705 ± 10 68 ± 10 9.6 ± 2.5 0.6 ± 0.3 1.4 ± 0.5 3.65 14 0.3043 4663 ± 36 219 ± 31 14.0 ± 4.1 1.0 ± 0.4 1.3 ± 0.5 3.24 17 0.6085 4685 ± 12 75 ± 13 5.9 ± 2.3 2.2 ± 1.0 1.2 ± 0.6 3.17 20 0.9128 4305 ± 12 61 ± 11 8.0 ± 2.4 0.7 ± 0.3 0.7 ± 0.3 3.25 21 1.0142 4360 ± 9 67 ± 9 18.7 ± 4.2 0.0 ± 0.1 0.4 ± 0.1 3.50

Slit 0: X-Offset 0.0^{′′}

4 -0.7099 5010 ± 29 97 ± 29 9.7 ± 4.8 1.3 ± 0.8 0.4 ± 0.4 2.02 7 -0.4057 4879 ± 13 174 ± 12 24.8 ± 5.3 2.9 ± 0.7 2.1 ± 0.5 2.07 8 -0.3043 4902 ± 5 157 ± 5 46.6 ± 5.7 4.3 ± 0.6 2.2 ± 0.3 2.01 9 -0.2028 4861 ± 10 173 ± 8 33.1 ± 5.7 3.5 ± 0.7 2.3 ± 0.5 2.15 10 -0.1014 4810 ± 9 95 ± 9 14.4 ± 4.2 3.0 ± 1.0 2.1 ± 0.7 1.96

Table 21—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

11 0.0000 4769 ± 8 52 ± 8 10.7 ± 3.5 1.9 ± 0.8 1.1 ± 0.5 1.97 12 0.1014 4747 ± 6 36 ± 7 13.2 ± 4.0 1.0 ± 0.4 0.5 ± 0.3 1.99 13 0.2028 4799 ± 17 83 ± 16 11.6 ± 4.5 0.2 ± 0.3 1.4 ± 0.7 1.92 18 0.7099 4606 ± 34 162 ± 33 8.5 ± 4.6 2.9 ± 1.8 1.1 ± 0.9 1.94 21 1.0142 4422 ± 45 166 ± 41 8.0 ± 4.8 1.8 ± 1.3 1.7 ± 1.2 2.29

Slit 2: X-Offset +0.2^{′′}

1 -1.0142 4826 ± 20 19 ± 9 5.3 ± 2.8 0.0 ± 0.2 0.2 ± 0.2 2.64 4 -0.7099 4984 ± 9 56 ± 9 4.9 ± 2.1 2.6 ± 1.3 1.7 ± 0.9 2.37 6 -0.5071 4983 ± 9 72 ± 9 6.9 ± 2.5 3.3 ± 1.4 1.0 ± 0.6 2.41 7 -0.4057 4978 ± 10 86 ± 10 12.1 ± 3.1 2.2 ± 0.7 1.0 ± 0.4 2.36 8 -0.3043 4929 ± 10 90 ± 9 15.9 ± 3.5 1.9 ± 0.5 0.7 ± 0.3 2.24 9 -0.2028 4899 ± 10 76 ± 9 10.1 ± 2.9 2.2 ± 0.8 1.5 ± 0.6 1.91 10 -0.1014 4865 ± 11 77 ± 11 7.5 ± 2.6 1.6 ± 0.8 2.9 ± 1.1 2.53 11 0.0000 4924 ± 32 143 ± 30 10.0 ± 4.1 1.7 ± 0.9 0.7 ± 0.5 2.49 12 0.1014 4918 ± 19 119 ± 19 5.3 ± 3.2 4.8 ± 3.1 0.4 ± 0.6 2.52 13 0.2028 4882 ± 15 88 ± 14 4.6 ± 2.8 4.2 ± 2.7 1.9 ± 1.3 2.50 14 0.3043 4861 ± 14 70 ± 13 4.1 ± 2.5 2.2 ± 1.5 2.4 ± 1.6 2.43 18 0.7099 5121 ± 41 132 ± 39 13.3 ± 5.4 0.1 ± 0.2 0.0 ± 0.2 2.47 19 0.8114 4800 ± 14 68 ± 14 3.0 ± 2.2 1.7 ± 1.4 3.6 ± 2.9 2.91

Table 22. NGC 5141: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

1 -1.0142 5498 ± 15 128 ± 15 6.0 ± 2.4 3.9 ± 1.7 1.4 ± 0.9 2.78 4 -0.7099 5335 ± 26 160 ± 25 5.2 ± 2.6 4.2 ± 2.3 0.5 ± 0.9 2.97 5 -0.6085 5494 ± 10 87 ± 10 8.9 ± 2.3 2.3 ± 0.7 0.8 ± 0.4 2.27 6 -0.5071 5389 ± 20 179 ± 18 7.1 ± 2.8 5.3 ± 2.2 0.7 ± 0.8 2.26 7 -0.4057 5456 ± 23 198 ± 21 10.8 ± 3.3 3.4 ± 1.2 0.6 ± 0.6 2.35 8 -0.3043 5383 ± 12 158 ± 11 12.6 ± 3.0 4.1 ± 1.1 2.1 ± 0.7 2.67 9 -0.2028 5295 ± 7 141 ± 7 25.5 ± 3.3 3.0 ± 0.5 2.3 ± 0.4 2.21 10 -0.1014 5265 ± 3 131 ± 3 50.9 ± 3.6 3.2 ± 0.3 1.5 ± 0.2 2.35 11 0.0000 5282 ± 2 107 ± 2 66.4 ± 3.6 2.9 ± 0.2 1.2 ± 0.1 2.43 12 0.1014 5243 ± 3 105 ± 3 50.2 ± 3.3 2.6 ± 0.2 0.8 ± 0.1 2.66 13 0.2028 5169 ± 2 62 ± 2 22.3 ± 2.5 3.4 ± 0.4 0.7 ± 0.2 2.44 14 0.3043 5123 ± 15 120 ± 15 9.6 ± 2.8 2.8 ± 1.0 0.7 ± 0.5 1.97 15 0.4057 5134 ± 13 80 ± 13 3.5 ± 2.0 4.6 ± 2.8 1.2 ± 1.2 2.10 16 0.5071 5058 ± 22 138 ± 22 18.1 ± 4.1 0.6 ± 0.2 0.5 ± 0.3 2.10 17 0.6085 4932 ± 57 275 ± 42 16.8 ± 4.7 1.4 ± 0.5 0.3 ± 0.4 2.36 18 0.7099 5032 ± 17 96 ± 17 3.1 ± 2.1 5.0 ± 3.7 0.6 ± 1.1 2.15

Slit 0: X-Offset 0.0^{′′}

Table 22—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) 1 -1.0142 5440 ± 26 103 ± 27 6.4 ± 3.2 2.1 ± 1.3 0.8 ± 0.9 2.24 3 -0.8114 5401 ± 15 94 ± 15 8.9 ± 3.1 2.4 ± 1.0 0.5 ± 0.6 2.03 5 -0.6085 5408 ± 14 117 ± 14 6.6 ± 3.0 5.5 ± 2.7 0.6 ± 0.8 2.20 6 -0.5071 5486 ± 20 107 ± 19 12.5 ± 3.8 1.6 ± 0.6 0.4 ± 0.4 2.05 7 -0.4057 5435 ± 17 148 ± 16 20.1 ± 4.3 1.9 ± 0.5 1.3 ± 0.4 1.77 8 -0.3043 5384 ± 13 183 ± 12 22.8 ± 4.6 3.4 ± 0.8 1.6 ± 0.5 1.80 9 -0.2028 5330 ± 5 165 ± 5 73.6 ± 5.2 2.4 ± 0.2 1.2 ± 0.1 1.99 10 -0.1014 5296 ± 3 186 ± 2 191.1 ± 6.8 2.6 ± 0.1 1.1 ± 0.1 2.53 11 0.0000 5228 ± 3 148 ± 3 140.1 ± 6.4 2.4 ± 0.1 0.9 ± 0.1 2.39 12 0.1014 5189 ± 3 106 ± 3 56.4 ± 4.8 3.3 ± 0.3 0.8 ± 0.1 1.71 13 0.2028 5134 ± 7 121 ± 7 30.9 ± 4.3 2.9 ± 0.5 0.6 ± 0.2 1.65 14 0.3043 5088 ± 17 132 ± 16 28.2 ± 5.5 1.0 ± 0.3 0.7 ± 0.3 1.84 15 0.4057 5103 ± 13 112 ± 13 23.5 ± 4.5 1.2 ± 0.3 0.5 ± 0.3 1.81 16 0.5071 4978 ± 50 263 ± 39 22.4 ± 6.3 1.4 ± 0.5 1.0 ± 0.5 2.19 17 0.6085 5344 ± 51 256 ± 41 14.0 ± 5.6 2.3 ± 1.0 1.2 ± 0.8 1.84 18 0.7099 5336 ± 36 213 ± 32 9.4 ± 4.8 3.6 ± 2.0 0.4 ± 0.7 2.21

Slit 2: X-Offset +0.2^{′′}

3 -0.8114 5462 ± 15 62 ± 15 6.3 ± 2.6 1.6 ± 0.8 0.3 ± 0.6 2.46 4 -0.7099 5523 ± 17 95 ± 17 15.0 ± 4.0 0.8 ± 0.3 0.2 ± 0.3 2.44 6 -0.5071 5326 ± 22 136 ± 21 4.5 ± 3.1 6.8 ± 4.9 1.1 ± 1.4 1.85

Table 22—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

7 -0.4057 5389 ± 16 112 ± 16 9.2 ± 3.2 3.0 ± 1.2 1.7 ± 0.9 2.04 8 -0.3043 5334 ± 15 100 ± 16 16.0 ± 4.0 1.1 ± 0.4 0.7 ± 0.4 2.22 9 -0.2028 5312 ± 7 115 ± 7 35.9 ± 4.1 1.8 ± 0.3 0.7 ± 0.2 1.81 10 -0.1014 5252 ± 4 122 ± 4 52.1 ± 4.1 2.5 ± 0.2 1.2 ± 0.2 2.06 11 0.0000 5215 ± 5 128 ± 5 53.9 ± 4.6 2.0 ± 0.2 0.8 ± 0.1 2.07 12 0.1014 5162 ± 6 112 ± 6 29.2 ± 3.8 2.5 ± 0.4 0.8 ± 0.2 1.98 13 0.2028 5110 ± 9 95 ± 9 14.2 ± 3.0 2.3 ± 0.6 0.8 ± 0.4 1.72 14 0.3043 5032 ± 14 141 ± 13 22.5 ± 4.0 1.6 ± 0.4 0.7 ± 0.3 2.47 15 0.4057 5062 ± 9 89 ± 8 18.1 ± 3.2 1.6 ± 0.4 0.6 ± 0.2 2.36 16 0.5071 5023 ± 19 113 ± 19 13.7 ± 3.7 1.0 ± 0.4 1.0 ± 0.5 2.15 19 0.8114 4973 ± 8 45 ± 8 9.2 ± 2.5 0.8 ± 0.3 0.1 ± 0.3 2.24 21 1.0142 5510 ± 15 42 ± 15 5.5 ± 2.8 0.1 ± 0.3 0.3 ± 0.4 2.74

Table 23. NGC 5490: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

3 -0.8114 5164 ± 33 76 ± 33 5.8 ± 3.5 0.5 ± 0.5 0.3 ± 0.6 2.42 5 -0.6085 5104 ± 7 33 ± 10 9.8 ± 4.1 0.1 ± 0.2 0.6 ± 0.4 2.05 10 -0.1014 5008 ± 16 162 ± 15 16.1 ± 4.4 3.4 ± 1.0 0.8 ± 0.5 2.02 11 0.0000 4999 ± 10 205 ± 9 41.3 ± 5.4 3.3 ± 0.5 0.8 ± 0.2 2.29 12 0.1014 5154 ± 11 261 ± 9 79.9 ± 7.0 2.6 ± 0.3 1.0 ± 0.2 2.29 13 0.2028 5220 ± 9 160 ± 8 29.9 ± 4.4 3.6 ± 0.6 1.5 ± 0.3 1.94 14 0.3043 5204 ± 18 145 ± 18 24.3 ± 5.3 1.3 ± 0.4 0.8 ± 0.3 2.00 16 0.5071 5213 ± 17 63 ± 17 7.9 ± 3.3 1.0 ± 0.6 0.5 ± 0.5 2.07 19 0.8114 5154 ± 17 77 ± 16 11.0 ± 3.4 0.9 ± 0.4 0.2 ± 0.3 2.45 20 0.9128 5002 ± 48 192 ± 39 7.4 ± 3.6 2.4 ± 1.4 1.0 ± 0.9 2.51

Slit 0: X-Offset 0.0^{′′}

2 -0.9128 5214 ± 10 34 ± 9 7.0 ± 3.6 0.0 ± 0.2 1.0 ± 0.7 2.21 3 -0.8114 5073 ± 8 39 ± 8 11.4 ± 3.4 0.1 ± 0.2 0.2 ± 0.2 2.37 6 -0.5071 5317 ± 9 38 ± 9 10.6 ± 3.6 0.2 ± 0.2 0.5 ± 0.4 2.20 7 -0.4057 5537 ± 28 115 ± 28 22.9 ± 8.2 0.3 ± 0.2 0.2 ± 0.3 1.79 10 -0.1014 4701 ± 11 280 ± 9 74.4 ± 7.4 3.4 ± 0.4 1.3 ± 0.2 2.24 13 0.2028 5058 ± 16 199 ± 14 40.2 ± 6.6 2.3 ± 0.5 0.7 ± 0.3 2.18

Table 23—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

18 0.7099 5491 ± 26 60 ± 25 7.4 ± 4.3 0.2 ± 0.4 0.2 ± 0.5 1.93 21 1.0142 5350 ± 37 131 ± 36 7.7 ± 3.7 1.7 ± 1.1 0.3 ± 0.7 2.43

Slit 2: X-Offset +0.2^{′′}

1 -1.0142 5222 ± 13 41 ± 13 6.1 ± 2.7 0.1 ± 0.2 0.1 ± 0.4 2.81 4 -0.7099 5506 ± 8 30 ± 7 −3.1 ± 1.7 1.1 ± 0.8 3.0 ± 2.0 2.38 13 0.2028 5083 ± 6 77 ± 6 15.3 ± 3.0 3.0 ± 0.7 0.4 ± 0.3 1.67 16 0.5071 5228 ± 36 131 ± 36 8.8 ± 4.0 1.5 ± 0.9 0.2 ± 0.6 1.91

Table 24. NGC 7052: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.1^{′′}

2 -0.4564 4310 ± 26 153 ± 23 35.8 ± 10.0 1.9 ± 0.7 0.3 ± 0.3 2.33 5 -0.3043 4466 ± 26 186 ± 24 28.5 ± 9.9 3.3 ± 1.3 0.6 ± 0.5 1.94 6 -0.2535 4527 ± 24 179 ± 22 25.7 ± 9.8 4.0 ± 1.7 0.7 ± 0.5 2.75 7 -0.2028 4461 ± 26 241 ± 22 50.7 ± 12.0 2.9 ± 0.8 1.0 ± 0.4 2.97 8 -0.1521 4481 ± 27 281 ± 21 86.0 ± 15.0 2.3 ± 0.5 1.6 ± 0.4 2.15 9 -0.1014 4487 ± 15 285 ± 12 167.2 ± 17.1 2.4 ± 0.3 1.1 ± 0.2 2.62 10 -0.0507 4463 ± 15 413 ± 14 289.4 ± 29.2 3.0 ± 0.3 1.1 ± 0.2 2.31 11 0.0000 4541 ± 17 456 ± 16 354.7 ± 35.1 2.7 ± 0.3 0.8 ± 0.1 2.94 12 0.0507 4722 ± 24 387 ± 22 148.1 ± 24.7 2.8 ± 0.5 0.9 ± 0.2 2.95 16 0.2535 4173 ± 7 37 ± 6 29.4 ± 7.9 0.4 ± 0.2 0.1 ± 0.2 2.29 18 0.3550 4130 ± 14 59 ± 13 20.7 ± 8.5 0.1 ± 0.3 1.2 ± 0.6 3.04 19 0.4057 4210 ± 15 54 ± 15 20.2 ± 7.7 0.0 ± 0.2 0.5 ± 0.5 2.56

Slit 0: X-Offset 0.0^{′′}

1 -0.5071 4434 ± 8 66 ± 7 87.2 ± 15.5 0.5 ± 0.1 0.4 ± 0.2 1.76 4 -0.3550 4606 ± 21 130 ± 20 37.3 ± 13.6 1.6 ± 0.7 1.8 ± 0.8 1.65 7 -0.2028 4511 ± 22 175 ± 19 59.6 ± 15.7 2.0 ± 0.6 1.6 ± 0.5 2.02 8 -0.1521 4558 ± 19 232 ± 18 48.1 ± 17.2 5.6 ± 2.1 1.5 ± 0.7 1.46

Table 24—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

9 -0.1014 4665 ± 14 265 ± 13 110.1 ± 20.7 4.1 ± 0.8 2.3 ± 0.5 1.54 10 -0.0507 4677 ± 10 268 ± 8 244.8 ± 24.5 3.1 ± 0.3 1.3 ± 0.2 2.09 11 0.0000 4772 ± 11 303 ± 9 285.5 ± 29.5 3.1 ± 0.4 0.5 ± 0.1 1.97 12 0.0507 4832 ± 17 346 ± 16 153.1 ± 28.8 4.1 ± 0.8 1.6 ± 0.4 1.91 14 0.1521 3887 ± 25 65 ± 24 21.6 ± 11.3 0.4 ± 0.4 0.4 ± 0.5 1.64

Slit 2: X-Offset +0.1^{′′}

1 -0.5071 4468 ± 9 84 ± 9 87.2 ± 14.6 0.5 ± 0.1 0.0 ± 0.1 1.91 2 -0.4564 4479 ± 15 99 ± 15 62.3 ± 13.8 0.4 ± 0.2 0.5 ± 0.2 1.73 3 -0.4057 4561 ± 13 75 ± 13 47.9 ± 12.4 0.7 ± 0.3 0.3 ± 0.2 1.82 4 -0.3550 4572 ± 18 114 ± 17 51.7 ± 13.3 1.3 ± 0.4 0.3 ± 0.2 2.24 5 -0.3043 4576 ± 20 105 ± 19 53.3 ± 14.5 0.6 ± 0.3 0.4 ± 0.2 1.99 6 -0.2535 4582 ± 13 79 ± 13 41.2 ± 10.9 0.9 ± 0.4 0.7 ± 0.3 1.82 7 -0.2028 4536 ± 21 127 ± 21 71.6 ± 16.4 0.2 ± 0.2 0.1 ± 0.2 1.87 8 -0.1521 4641 ± 9 69 ± 9 55.7 ± 11.1 1.0 ± 0.3 0.2 ± 0.2 2.06 9 -0.1014 4667 ± 11 126 ± 11 73.4 ± 12.1 1.8 ± 0.4 0.8 ± 0.2 1.91 10 -0.0507 4670 ± 7 109 ± 7 68.4 ± 10.4 2.3 ± 0.4 1.6 ± 0.3 1.73 11 0.0000 4678 ± 9 137 ± 9 65.2 ± 11.1 2.6 ± 0.5 2.1 ± 0.4 2.11 13 0.1014 4726 ± 13 87 ± 12 14.5 ± 7.5 5.8 ± 3.2 0.9 ± 0.8 1.62 14 0.1521 4759 ± 33 125 ± 33 32.5 ± 13.3 1.1 ± 0.6 0.2 ± 0.3 1.50 16 0.2535 4738 ± 32 132 ± 32 20.8 ± 10.5 1.7 ± 1.1 1.8 ± 1.2 2.30

Table 24—Continued Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) 20 0.4564 3941 ± 15 73 ± 15 11.0 ± 5.9 2.9 ± 1.8 2.6 ± 1.6 1.96

Table 25. UGC 12064: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.1^{′′}

2 -0.4564 4876 ± 17 136 ± 17 39.5 ± 10.9 1.8 ± 0.6 1.3 ± 0.5 2.29 3 -0.4057 4971 ± 18 107 ± 18 47.6 ± 11.6 0.4 ± 0.2 0.7 ± 0.3 1.88 4 -0.3550 4962 ± 19 73 ± 19 29.8 ± 10.6 0.1 ± 0.2 0.2 ± 0.3 2.06 5 -0.3043 4880 ± 25 127 ± 25 37.2 ± 11.3 1.0 ± 0.4 0.1 ± 0.3 2.24 6 -0.2535 4868 ± 18 134 ± 16 44.1 ± 10.1 1.7 ± 0.5 0.0 ± 0.3 2.11 7 -0.2028 4940 ± 13 47 ± 12 17.8 ± 7.1 0.5 ± 0.4 0.9 ± 0.6 1.77 8 -0.1521 4957 ± 8 46 ± 8 32.3 ± 8.5 0.4 ± 0.2 0.7 ± 0.3 2.44 9 -0.1014 5015 ± 21 191 ± 18 69.0 ± 13.2 1.6 ± 0.4 0.7 ± 0.3 2.36 10 -0.0507 5085 ± 22 259 ± 20 37.9 ± 13.4 5.4 ± 2.0 2.4 ± 1.0 2.13 11 0.0000 5141 ± 21 248 ± 15 87.6 ± 14.6 2.6 ± 0.5 0.9 ± 0.3 1.81 12 0.0507 5231 ± 26 305 ± 21 93.0 ± 17.7 3.1 ± 0.7 1.2 ± 0.3 1.97 18 0.3550 5121 ± 13 40 ± 12 10.7 ± 5.9 1.4 ± 1.0 0.5 ± 0.7 2.26

Slit 0: X-Offset 0.0^{′′}

2 -0.4564 4783 ± 36 174 ± 34 87.6 ± 24.2 0.3 ± 0.2 0.4 ± 0.3 1.63 3 -0.4057 4795 ± 43 157 ± 41 44.9 ± 18.3 1.1 ± 0.6 0.3 ± 0.4 1.63 5 -0.3043 4963 ± 28 82 ± 29 23.2 ± 14.3 1.2 ± 1.0 0.5 ± 0.7 1.56 6 -0.2535 4951 ± 49 189 ± 44 35.9 ± 17.5 1.8 ± 1.1 1.0 ± 0.8 1.41

Table 25—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

8 -0.1521 4846 ± 42 245 ± 36 35.5 ± 17.8 3.8 ± 2.1 2.8 ± 1.6 1.63 10 -0.0507 5070 ± 15 341 ± 14 265.0 ± 31.6 3.3 ± 0.4 1.1 ± 0.2 1.25 11 0.0000 5186 ± 15 496 ± 13 304.5 ± 62.6 7.1 ± 1.5 1.7 ± 0.4 1.67 12 0.0507 5207 ± 14 444 ± 13 446.8 ± 53.5 4.3 ± 0.5 1.0 ± 0.2 2.28 13 0.1014 5187 ± 32 320 ± 27 132.7 ± 28.3 2.7 ± 0.7 0.8 ± 0.3 1.73 19 0.4057 5128 ± 30 97 ± 30 43.7 ± 18.4 0.2 ± 0.2 0.2 ± 0.3 1.68 20 0.4564 5170 ± 35 121 ± 34 36.4 ± 16.2 0.3 ± 0.4 1.3 ± 0.9 1.86 21 0.5071 5086 ± 32 79 ± 32 22.2 ± 15.6 1.1 ± 1.1 0.2 ± 0.6 1.71

Slit 2: X-Offset +0.1^{′′}

1 -0.5071 5016 ± 38 199 ± 34 23.1 ± 10.8 3.0 ± 1.6 0.9 ± 0.8 1.65 2 -0.4564 4863 ± 8 38 ± 7 29.0 ± 8.2 0.6 ± 0.3 0.0 ± 0.2 1.81 3 -0.4057 4881 ± 41 134 ± 42 14.8 ± 9.4 2.1 ± 1.6 0.2 ± 0.8 1.72 8 -0.1521 4884 ± 18 160 ± 17 21.5 ± 9.0 4.7 ± 2.1 3.2 ± 1.5 1.73 9 -0.1014 4914 ± 19 237 ± 17 47.7 ± 12.1 4.1 ± 1.1 1.8 ± 0.6 1.89 10 -0.0507 4926 ± 15 257 ± 12 96.8 ± 14.1 3.3 ± 0.5 1.1 ± 0.3 1.88 11 0.0000 4939 ± 16 304 ± 14 127.4 ± 17.4 3.3 ± 0.5 1.1 ± 0.2 1.72 14 0.1521 5081 ± 45 199 ± 38 38.5 ± 13.1 1.3 ± 0.6 0.6 ± 0.4 2.36 15 0.2028 5088 ± 23 101 ± 22 41.0 ± 12.5 0.1 ± 0.2 0.5 ± 0.3 2.03 16 0.2535 5197 ± 33 97 ± 33 11.2 ± 7.7 2.1 ± 1.8 1.2 ± 1.3 1.69 18 0.3550 4867 ± 38 143 ± 37 43.4 ± 15.4 0.1 ± 0.2 0.3 ± 0.3 1.75

Table 25—Continued Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Table 26. NGC 7626: Measured Parameters.

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

Slit 1: X-Offset -0.2^{′′}

8 -0.3043 3554 ± 30 210 ± 25 17.5 ± 4.1 1.6 ± 0.5 0.5 ± 0.3 2.25 9 -0.2028 3583 ± 22 230 ± 18 22.5 ± 4.2 2.3 ± 0.5 0.4 ± 0.3 2.17 10 -0.1014 3457 ± 13 200 ± 12 34.4 ± 4.1 1.9 ± 0.3 0.9 ± 0.2 2.46 11 0.0000 3378 ± 8 152 ± 8 14.0 ± 3.1 5.1 ± 1.2 1.4 ± 0.5 2.32 12 0.1014 3332 ± 15 185 ± 14 8.6 ± 3.4 6.5 ± 2.6 1.3 ± 0.8 2.51 13 0.2028 3331 ± 18 163 ± 17 20.5 ± 4.0 1.5 ± 0.4 0.4 ± 0.3 2.14 14 0.3043 3295 ± 27 155 ± 27 13.4 ± 4.1 1.3 ± 0.5 0.4 ± 0.4 2.25 16 0.5071 3289 ± 16 63 ± 16 7.9 ± 2.8 0.0 ± 0.2 0.2 ± 0.3 2.89 17 0.6085 3412 ± 36 147 ± 35 9.7 ± 3.5 0.8 ± 0.4 0.1 ± 0.4 2.61 18 0.7099 3572 ± 23 93 ± 23 10.2 ± 3.3 0.1 ± 0.2 0.1 ± 0.3 3.05 19 0.8114 4142 ± 23 170 ± 21 16.7 ± 3.4 1.0 ± 0.3 0.4 ± 0.2 3.42

Slit 0: X-Offset 0.0^{′′}

1 -1.0142 3116 ± 34 156 ± 33 4.8 ± 3.0 3.9 ± 2.7 0.5 ± 1.0 2.74 2 -0.9128 3191 ± 43 197 ± 38 8.1 ± 3.8 2.6 ± 1.4 0.5 ± 0.7 2.33 6 -0.5071 3630 ± 39 184 ± 36 6.2 ± 3.9 4.2 ± 2.9 0.3 ± 1.0 2.16 7 -0.4057 3568 ± 10 104 ± 10 7.1 ± 2.9 5.6 ± 2.4 2.0 ± 1.0 1.83 8 -0.3043 3605 ± 9 153 ± 8 34.7 ± 4.3 2.5 ± 0.4 1.3 ± 0.2 1.96

Table 26—Continued

Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα)

9 -0.2028 3607 ± 5 171 ± 5 65.4 ± 4.8 2.9 ± 0.3 1.2 ± 0.1 1.97 10 -0.1014 3552 ± 4 260 ± 3 217.8 ± 7.7 2.3 ± 0.1 1.0 ± 0.1 2.43 11 0.0000 3446 ± 5 349 ± 5 261.0 ± 11.3 3.2 ± 0.2 1.1 ± 0.1 2.64 12 0.1014 3227 ± 4 223 ± 3 136.0 ± 6.2 2.6 ± 0.1 1.0 ± 0.1 2.58 13 0.2028 3216 ± 6 151 ± 6 44.4 ± 4.3 2.7 ± 0.3 0.9 ± 0.2 2.08 14 0.3043 3235 ± 13 157 ± 13 21.7 ± 4.1 2.5 ± 0.6 0.5 ± 0.3 2.23 16 0.5071 3417 ± 24 95 ± 24 12.4 ± 4.4 0.5 ± 0.3 0.4 ± 0.4 2.32 17 0.6085 3470 ± 16 84 ± 16 7.9 ± 2.9 1.8 ± 0.8 0.3 ± 0.5 2.21 21 1.0142 3136 ± 27 118 ± 28 8.9 ± 3.5 1.1 ± 0.6 1.0 ± 0.7 2.29

Slit 2: X-Offset +0.2^{′′}

5 -0.6085 3780 ± 5 29 ± 5 7.0 ± 2.1 0.1 ± 0.2 1.1 ± 0.5 2.06 6 -0.5071 3849 ± 18 69 ± 18 5.6 ± 2.5 0.6 ± 0.5 2.3 ± 1.3 2.84 10 -0.1014 3479 ± 14 181 ± 14 12.0 ± 3.7 5.5 ± 1.8 1.6 ± 0.7 1.97 11 0.0000 3433 ± 6 135 ± 6 33.9 ± 3.7 2.9 ± 0.4 0.8 ± 0.2 2.36 12 0.1014 3405 ± 7 119 ± 7 27.1 ± 3.5 2.4 ± 0.4 0.1 ± 0.2 1.90 15 0.4057 3442 ± 27 185 ± 25 10.7 ± 3.5 2.6 ± 1.0 0.2 ± 0.5 2.42 16 0.5071 3377 ± 10 51 ± 10 6.0 ± 2.1 1.5 ± 0.7 0.3 ± 0.4 2.29 17 0.6085 3391 ± 10 34 ± 11 2.9 ± 1.7 1.3 ± 1.0 1.2 ± 1.1 2.33 18 0.7099 3275 ± 42 163 ± 41 6.9 ± 3.3 1.5 ± 1.0 1.5 ± 1.0 2.19 19 0.8114 3579 ± 15 56 ± 15 3.8 ± 1.9 1.2 ± 0.8 2.2 ± 1.3 2.65

Table 26—Continued Row Y-Offset v_r σ_{gas} F(Hα/10^{−16}) F(N II_{6585}) F(S II_{total}) R^2 (^{′′}) (km s^{−1}) (km s^{−1}) (erg s^{−1}cm^{−2}Hz^{−1}) F(Hα) F(Hα) 20 0.9128 3518 ± 10 31 ± 10 4.0 ± 1.9 0.3 ± 0.3 1.0 ± 0.7 2.37

Table 27. Effect of making various fit parameters free.

Fit description v_{Hα} v_{[NII]} σ_{Hα} σ_{[NII]} F([N II]_{6585}) R^2 (km s^{−1}) (km s^{−1}) (km s^{−1}) (km s^{−1}) F([N II]_{6549}) (1) (2) (3) (4) (5) (6) (7)

initial parameters 4620 ± 4 249 ± 3 3.0 3.21 v_{Hα} free 4616 ± 9 4620 ± 3 249 ± 3 3.0 3.22 σ_{Hα} free 4619 ± 3 228 ± 9 256 ± 4 3.0 3.21 v_{Hα} + σ_{Hα} free 4618 ± 9 4619 ± 4 228 ± 9 256 ± 4 3.0 3.22 [N II] ratio free 4622 ± 3 248 ± 3 2.32 ± 0.09 3.04

Note. — The measurements shown were made using the central spectral row in the central slit observed for NGC 4335. Col. (1): Parameters made free, Initially a set of lines with one velocity and one velocity dispersion was used, with the ratio of the two [N II] lines fixed to 3.0. The two [S II] lines are fixed in velocity and width to the [N II] lines in every case; Col. (2-3): The radial velocities of the Hα and [N II] lines; Col. (3-4): The velocity dispersions of the Hα and [N II] lines; Col. (5): The ratio of the [N II]_{6585} and [N II]_{6549} lines; Col. (6): The reduced χ^2 value of the resulting fit.

Table 28. Presence of a Nuclear Broad Line.

Galaxy Δ|residual| R^2_N − R^2_A By eye Score Broad Cpt. (%) R^2_N (1) (2) (3) (4) (5) (6)

NGC 193 9.6 0.19 ✓ 3 Yes NGC 315 25.0 0.46 ✓ 3 Yes NGC 383 8.7 0.16 ∘ 2 Yes NGC 541 4.6 0.12 ✓ 1 No NGC 741 1.9 0.01 ∘ 0 No UGC 1841 14.7 0.35 ✓ 3 Yes NGC 2329 9.4 0.32 ∘ 2 * NGC 2892 2.8 0.09 ∘ 0 No NGC 3801 0.1 0.01 ∘ 0 No NGC 3862 8.0 0.22 ∘ 2 * UGC 7115 2.6 0.09 ∘ 0 No NGC 4261 7.8 0.22 ✓ 3 Yes NGC 4335 8.0 0.40 ✓ 3 Yes NGC 4374 2.4 0.12 ∘ 0 No NGC 4486 3.4 0.15 ✓ 2 Yes NGC 5127 -1.5 -0.01 ∘ 0 No NGC 5141 3.7 0.16 ✓ 2 Yes NGC 5490 5.2 0.23 ✓ 3 Yes NGC 7052 4.9 0.04 ✓ 1 No UGC 12064 6.7 0.11 ✓ 2 Yes NGC 7626 2.5 0.13 ✓ 2 Yes

Note. — Col. (1): NGC/UGC Identification; Col. (2): Difference in the mean of the absolute values of the residuals from the fits including and excluding the additional component; Col. (3): Relative change in reduced χ^2 value between fits with the narrow lines alone (N) and with the additional component (A); Col. (4): Could an improvement in the fit be judged by eye?; Col. (5): Additional component ‘score’, one point available from each of columns 2 to 6, see text for criteria; Col. (6) Is an additional broad component useful in the fit based on these results? An asterisk (*) indicates the component appears to represent a non-flat continuum.

Table 29. Fits to the central pixel for each galaxy, including broad lines. Kinematics.

Galaxy Row v_r(NL) v_r(BL) σ_{gas}(NL) σ_{gas}(BL) R^2 (km s^{−1}) (km s^{−1}) (km s^{−1}) (km s^{−1}) (1) (2) (3) (4) (5) (6) (7)

NGC 193 11 4417 ± 7 5128 ± 36 277 ± 6 967 ± 21 3.15 NGC 315 11 4830 ± 9 5738 ± 55 406 ± 9 1790 ± 67 2.06 NGC 383 11 5278 ± 54 5568 ± 29 669 ± 39 1367 ± 79 2.25 UGC 1841 11 6409 ± 8 6585 ± 20 436 ± 7 1254 ± 35 3.11 NGC 4261^† 11 2056 ± 9 2703 ± 68 366 ± 12 1079 ± 55 1.69 NGC 4335 11 4618 ± 3 4893 ± 37 188 ± 4 1299 ± 51 1.93 NGC 4486 11 1417 ± 14 1408 ± 28 534 ± 12 1479 ± 42 6.01 NGC 5141 11 5229 ± 3 5356 ± 86 121 ± 4 1223 ± 96 2.01 NGC 5490 11 4733 ± 16 5621 ± 61 377 ± 22 1336 ± 56 1.94 UGC 12064 11 5195 ± 16 5417 ± 90 423 ± 19 1321 ± 168 1.49 NGC 7626 11 3432 ± 7 4083 ± 76 287 ± 10 1126 ± 73 2.29

Note. — †For NGC 4261 slit 1 (offset -0.1 arcsec) was used; Col. (1): NGC/UGC Number; Col. (2): Central pixel row number referenced from the earlier data tables for each galaxy; Col. (3): The line of sight velocities of the narrow line components; Col. (4): The line of sight velocities of the broad components (where present); Col. (5): The line of sight velocity dispersions of the narrow line components; Col. (6): The line of sight velocity dispersions of the broad components (where present); Col. (7): The reduced χ^2 value of the fit. The parameters were measured by fitting a models with 5 narrow lines, fixed to each other in velocity and velocity dispersion and one free broad component, except as noted above. Errors quoted are the formal errors on the various parameters from the fit.

Table 30. Fits to the central pixel for each galaxy, including broad lines. Fluxes.

Galaxy F(Hα_{Narrow}) F([N II]_{6585}) F([S II]_{total}) F(Broad Line) F([S II]_{6733}) (ergs^{−1}cm^{−2}Hz^{−1}) F(Hα_{Narrow}) F(Hα_{Narrow}) F(Hα_{Narrow}) F([S II]_{6718}) (1) (2) (3) (4) (5) (6)

NGC 193 1.33 ± 0.23 4.21 ± 0.77 3.86 ± 0.71 7.60 ± 1.46 1.18 ± 0.07 NGC 315 9.28 ± 0.77 4.72 ± 0.42 1.81 ± 0.21 4.40 ± 0.51 1.80 ± 0.14 NGC 383 27.72 ± 3.65 0.33 ± 0.18 0.56 ± 0.63 2.14 ± 0.50 0.11 ± 0.12 UGC 1841 7.71 ± 0.46 2.41 ± 0.16 1.39 ± 0.11 2.57 ± 0.28 1.09 ± 0.06 NGC 4261 4.36 ± 1.53 6.76 ± 2.42 3.37 ± 1.23 7.22 ± 2.93 1.55 ± 0.15 NGC 4335 1.33 ± 0.13 4.46 ± 0.44 2.63 ± 0.32 7.54 ± 0.87 1.04 ± 0.08 NGC 4486 44.96 ± 1.53 0.43 ± 0.04 0.59 ± 0.60 1.37 ± 0.11 0.03 ± 0.03 NGC 5141 0.91 ± 0.07 2.95 ± 0.25 1.38 ± 0.22 3.11 ± 0.45 0.97 ± 0.14 NGC 5490 0.25 ± 0.20 14.34 ± 11.64 9.12 ± 7.56 40.54 ± 32.95 1.94 ± 0.38 UGC 12064 0.48 ± 1.14 30.72 ± 72.97 11.16 ± 26.60 32.31 ± 77.41 0.58 ± 0.12 NGC 7626 1.48 ± 0.24 3.80 ± 0.66 1.98 ± 0.38 4.00 ± 1.01 0.95 ± 0.09

Note. — Col. (1): NGC/UGC Number; Col. (2): Hα narrow line flux; Col. (3): Ratio of the broad line flux to the Hα narrow line flux; Col. (4) Ratio of the [N II]_{6585} narrow line flux to the Hα Narrow line flux; Col. (5) Ratio of the total [S II] flux to the Hα Narrow line flux; Col. (6) Ratio of the [S II]_{6733} narrow line to the [S II]_{6718} narrow line. The parameters were measured by fitting a models with 5 narrow lines, fixed to each other in velocity and velocity dispersion and one free broad component, except as noted above. Errors quoted are the formal errors on the various parameters from the fit.

Table 31. Kinematic estimators within 100 pc of the nucleus.

Galaxy r_{max.} σ_{nuc.} σ̄_{100pc} Δ_{100pc} (pc) (km s^{−1}) (km s^{−1}) (km s^{−1}) (1) (2) (3) (4) (5)

Rotators

NGC 315 · · · 528 290 353 NGC 383 · · · 924 342 434 NGC 2329 · · · 302 145 84 UGC 7115 · · · 497 287 337 NGC 4261 78 459 238 319 NGC 4335 · · · 249 166 307 M 84 41 883 229 669 NGC 4486 41 612 313 607 NGC 5127 · · · 157 148 69 NGC 5141 · · · 149 146 196 NGC 7052 · · · 303 226 945 UGC 12064 · · · 497 308 361 NGC 7626 · · · 350 175 391 Mean 463 ± 254 236 ± 72 390 ± 250

Non-Rotators

NGC 193 · · · 437 228 253 NGC 541 · · · 336 182 266 UGC 1841 · · · 593 378 16 NGC 2892 · · · 453 338 118 NGC 3801 · · · 163 143 113 NGC 3862 · · · 303 182 130 NGC 5490 · · · 680 240 358 Mean 381 ± 147 242 ± 95 149 ± 95

Note. — Col. (1): Galaxy ID; Col. (2): Where the radius away from the central pixel used was less than 100 pc the radius is indicated here; Col. (3): The velocity dispersion of the very central spectrum; Col. (4): The mean velocity dispersion within 100 pc of the central position; Col. (5): The difference in mean velocities within 100 pc to either side of the central spectrum. The galaxies are grouped into two classes ‘rotators’ and ‘non-rotators’ judged by eye as discussed in the text, mean values of each parameter are given for each class.

Table 32. Comparison of broad line statistics

Parameter UGC FR-I sample Sy/LINERs Radio Loud (1) (2) (3) (4)

< σ_{BL} > (km s^{−1}) 1295 ± 218 2400 ± 1100 5900 ± 3700 < σ_{NL} > (km s^{−1}) 371 ± 153 · · · · · · < v_{NL} − v_{BL} > (km s^{−1}) −435 ± 335 · · · −500 ± 1200

Note. — The mean velocity dispersions of broad and narrow lines and offsets of broad and narrow lines for three different galaxy samples: Col.(2) the data presented in this work; Col. (3) A sample of Seyferts and LINERs; Col. (4) A summary of properties of several sample of radio galaxies.

References. — (3) Ho, et al. (1997); (4) Sulentic, et al. (2000)

Table 33. Kinematic parameters measured using various free-parameter sets.

Model ID Description v_r(NL) v_r(BB) v_r(BC) σ_{gas}(NL) σ_{gas}(BB) σ_{gas}(BC) R^2 (km s^{−1}) (km s^{−1}) (km s^{−1}) (km s^{−1}) (km s^{−1}) (km s^{−1}) (1) (2) (3) (4) (5) (6) (7) (8) (9)

1 Narrow lines only 4620 · · · · · · 249 · · · · · · 3.21 2 Model 1 + Extra Broad Component 4618 · · · 4893 188 · · · 1299 1.93 3 Model 2 + Constrained Broad Bases (i) 4616 = 4616 4767 139 354 1565 1.73 4 Model 2 + Constrained Broad Bases (ii) 4595 4724 4680 139 319 1417 1.60 5 Model 2 + Unconstrained Broad Bases 4616 = 4616 4764 128 319 1389 1.68

Note. — Col. (1) Model ID (see text); Col. (2): Brief description of the fit; Cols. (3-5): The radial velocities of the narrow line (NL), broad base (BB) and broad components (BC) respectively; Cols. (6-8): The velocity dispersions of the narrow line (NL), broad base (BB) and broad components (BC) respectively. Fits were performed on the central row of the central slit of the observations of NGC 4335; Col. (9): The reduced χ^2 value of the fit.