arXiv:astro-ph/0102231v1 13 Feb 2001

A&A manuscript no. (will be inserted by hand later) Your thesaurus codes are: 08(08.15.1)

ASTRONOMY AND ASTROPHYSICS

The radial pulsation of AI Aurigae

L.L. Kiss^1 and B.A. Skiff^2

1 Department of Experimental Physics and Astronomical Observatory, University of Szeged, Szeged, Dóm tér 9., H-6720 Hungary 2 Lowell Observatory, 1400 West Mars Hill Road, Flagstaff AZ 86001, USA

Abstract. We present an analysis of eleven years of Strömgren by photometry of the red semiregular variable star AI Aurigae. An early period determination of 63.9 days is confirmed by the long-term light curve behaviour. The light curve shows semi-regular changes with a mean period of 65 days reaching an amplitude of 0.^m6 in some cycles. The b − y colour changes perfectly parallel the V light curve, suggesting radial oscillation to be the main reason for the observed variations. We estimate the main characteristics of the star (mass, radius, effective temperature) that suggest radial pulsation in fundamental or first overtone mode.

Key words: stars: pulsation – stars: AGB – stars: individual: AI Aur

1. Introduction

The light variation of semiregular variables (SR) of subtype SRa and SRb is generally associated with the pulsation of these low and intermediate mass red giants located on the asymptotic giant branch (AGB) of the Hertzsprung–Russell diagram. Since the characteristic timescale of the variations is between 20 and 2000 days (usually hundreds of days), semiregulars are typical targets of amateur observers estimating visual brightnesses. There are very few high-precision light, colour, and/or radial-velocity measurement covering many cycles that confirm the pulsational origin of the variations. Very recently, Lebzelter and his co-workers (Lebzelter 1999ab, Lebzelter et al. 1999) presented high-precision photometric and infrared radial-velocity data for a sample of bright SR stars. Their results both illustrate the ability of automatic telescopes to monitor this type of variable stars and support the assumption of pulsation (see also Percy et al. 1996 on involving amateur photoelectric observers into regular observations of small-amplitude red variables, SARVs).

However, one cannot ad hoc accept pulsation to be the main reason of variability. As has been noted by Percy

Send offprint requests to: l.kiss@physx.u-szeged.hu

& Polano (1998), virtually every M giant is variable in brightness. This has been also supported by the largescale photometric surveys (Hipparcos, MACHO, OGLE) leading to the discovery of thousands of M-type variables. It has been pointed out by, e.g. Lebzelter et al. (2000) and Kiss et al. (2000), that specifying the physical reason responsible for the variation requires simultaneous light, colour, and radial-velocity data, as even consecutive cycles may show significant deviations. This kind of longterm observation is crucial when studying the possible mechanisms affecting the light changes of SR variables. Besides pulsation, other contributors to variability cannot be readily excluded, such as time dependent surface inhomogeneities due to large convective cells (Schwarzschild 1975, Lebzelter et al. 2000), ellipsoidal deformation due to the presence of a close companion, or spots on a relatively rapidly-rotating star. Most recently, Koen & Laney (2000) gave a detailed list of considerations concerning the possible reasons of variability and noted, that there is still no definite conclusion on this issue. Until the application of these mechanisms is better understood, each case must be studied separately.

AI Aurigae (HD 259342, 9.^m1 < V < 9.^m8, P = 63.^d9, spectral type M5III - Chuadze 1973) is a poorly-studied red semiregular (subtype SRa) variable star. In the General Catalogue of Variable Stars (GCVS – Kholopov et al. 1985-1988) a period of 63.^d9 is listed with an early epoch of maximum (JD 2426029, due to Beyer (1937)). Since then there has been no other photometric measurement published for this star. Due to the relatively small range of light changes, it is also neglected by the international organizations of amateur variable star observers (American Assocation of Variable Star Observers – AAVSO, Association Francaise des Observateurs d’Etoiles Variables – AFOEV and Variable Star Observers’ League in Japan – VSOLJ). The AAVSO International Database does not contain this star, AFOEV has 16 points which are wrongly identified with AI Aur (they are 2 mag brighter), and VSOLJ collected only 30 individual estimates between 1986 and 1999. Similar neglect is present concerning other observations: there was only one radial velocity monitoring (⟨v_r ⟩ = +63 km s^{−1}, Feast et al. 1972), while Dickinson

& Dinger (1982) listed AI Aur among the negative detections during their H_2O survey. There is no metallicity determination in the literature. Its infrared colours (see later) place the star among the “blue” SRs (Kerschbaum & Hron 1992) and the presently available data suggest the star to be a regular member of this group.

The main aim of this paper is to present a continuous photometric monitoring of AI Aur between 1985 and 1996 which reveals the associated colour variations in addition to obtaining an accurate light curve. (We note, that the presented observations were acquired during a largescale photometric survey of solar type stars (Lockwood et al. 1997), without any specific reason. Therefore, this study is a by-product of that long-term observing programme.) The observed behaviour of AI Aur is very likely to be mainly due to radial pulsation, most probably in fundamental or low-degree overtone mode. The next section deals with the data aquisition, while the light- and colourcurves are discussed in Sect. 3 together with the physical parameters of the star. A summary of the conclusions is given in Sect. 4.

2. Observations

AI Aurigae was observed on 199 nights between 12 Oct 1985 and 8 Dec 1996. The observations were carried out at Lowell Observatory with the 0.53 m telescope. The detector was a single-channel photoelectric photometer (EMI 6256S tube) equipped with Strömgren b and y filters. The measurements were obtained almost always through a 29^{′′} diaphragm; some measurements in bad seeing were made through a 49^{′′} aperture, and in bright Moonlight a 19^{′′} aperture was occasionally used.

The differential magnitudes were aquired relative to HD 46159 (V =8.^m054, b − y=0.^m623, G8III), while the photometric stability was checked against HD 259662 (V =9.^m556, b − y=0.^m639, K0III). The data were corrected only for differential extinction using long-term monthly means for k_b and k_y (Lockwood & Thompson 1986). The standard transformations are represented with slight colour terms (roughly V = y + 0.05(b − y)_i, b − y = 1.08(b − y)_i). The internal consistency is of order of 0.^m005 as suggested by the rms errors of the means for the comparison stars in y and b (0.^m0046 and 0.^m0048). The quoted standard values for the comparison stars were determined on four nights from standard star observations (extending to several very red Landolt stars). Due to the red colour of the variable, there might be some remaining systematic shift of 0.^m020-0.^m025 in the V brightness. In any case, the scatter of the observations is essentially negligible compared to the range of the variations. The data (mean values of var−comp and var−check) are presented in Table 1 (available electronically and/or in printed version?) and plotted in Fig. 1.

Fig. 1. The light and colour curves of AI Aur between 1985 and 1996. Note the 600-day break between MJD 48000 and 48600

3. Discussion

In the following, we characterize the observed light variations, discuss the importance of the colour measurements and compare AI Aur with other semiregulars with available similar data series.

3.1. Period analysis

Data presented in Table 1 are plotted in Fig. 1. Note that some parts are excluded from the presentation due to the sparse light curve coverage (between MJD 48000-48600). However, when analysing the whole dataset, we have also used those data that are not presented in Fig. 1. Qualitatively the light curve is that of a typical semiregular without strictly repeating cycles. This has been investigated in

Table 1. Strömgren photometry of AI Aurigae (MJD=JD−2400000) MJD V b − y MJD V b − y MJD V b − y MJD V b − y 46351.000 9.182 1.348 46765.900 9.346 1.330 47529.783 9.451 1.357 48991.754 9.477 1.376 46352.996 9.192 1.353 46768.933 9.354 1.336 47535.796 9.384 1.348 49016.708 9.659 1.402 46353.996 9.205 1.348 46777.838 9.367 1.360 47541.771 9.261 1.347 49020.617 9.708 1.427 46357.987 9.259 1.352 46806.787 9.159 1.341 47542.725 9.261 1.350 49051.654 9.435 1.394 46362.975 9.357 1.368 46807.771 9.168 1.329 47544.725 9.248 1.345 49054.658 9.396 1.406 46375.958 9.609 1.413 46827.758 9.463 1.389 47578.683 9.389 1.382 49058.675 9.373 1.385 46376.954 9.615 1.401 46828.763 9.450 1.398 47579.679 9.407 1.379 49325.792 9.474 1.382 46385.942 9.693 1.421 46831.833 9.447 1.396 47585.704 9.455 1.389 49326.829 9.463 1.389 46388.917 9.714 1.422 46832.750 9.442 1.385 47586.658 9.471 1.392 49329.821 9.425 1.403 46389.921 9.717 1.440 46848.721 9.332 1.352 47592.658 9.536 1.414 49330.871 9.407 1.389 46403.917 9.457 1.387 46853.692 9.275 1.338 47599.671 9.522 1.391 49371.754 9.363 1.378 46420.813 9.236 1.361 46857.658 9.217 1.319 47606.671 9.423 1.385 49373.775 9.358 1.385 46421.817 9.240 1.359 46858.683 9.198 1.325 47618.633 9.232 1.356 49382.812 9.326 1.354 46431.875 9.297 1.373 46862.700 9.164 1.314 47623.633 9.195 1.342 49384.687 9.311 1.371 46449.850 9.547 1.399 46867.650 9.127 1.321 47624.625 9.196 1.334 49395.692 9.398 1.382 46450.742 9.561 1.420 46880.638 9.358 1.359 47626.625 9.194 1.347 49398.725 9.467 1.436 46457.783 9.563 1.373 46881.658 9.387 1.336 47640.638 9.430 1.392 49439.617 9.435 1.362 46463.767 9.483 1.396 46885.675 9.435 1.340 47826.929 9.181 1.321 49447.642 9.378 1.383 46483.675 9.200 1.356 46898.629 9.408 1.333 47843.900 9.357 1.324 49633.958 9.200 1.349 46484.662 9.535 1.380 46899.629 9.419 1.310 47880.813 9.375 1.328 49670.883 9.617 1.388 46486.700 9.206 1.364 47103.987 9.305 1.358 47896.683 9.328 1.343 49684.858 9.678 1.411 46487.679 9.205 1.359 47115.937 9.055 1.334 47915.692 9.445 1.353 49685.842 9.662 1.418 46490.700 9.239 1.357 47118.950 9.066 1.341 47919.754 9.519 1.373 49687.800 9.639 1.411 46496.667 9.355 1.373 47125.892 9.205 1.336 47921.779 9.539 1.369 49707.787 9.479 1.381 46510.671 9.509 1.391 47140.846 9.572 1.416 47925.683 9.530 1.379 49750.696 9.480 1.390 46511.671 9.529 1.373 47148.838 9.765 1.425 47932.683 9.481 1.366 49752.713 9.450 1.386 46512.662 9.535 1.380 47150.871 9.786 1.444 47969.667 9.090 1.323 49754.692 9.449 1.378 46516.650 9.557 1.382 47170.763 9.267 1.369 47972.650 9.195 1.336 49757.708 9.438 1.381 46530.650 9.430 1.360 47172.829 9.239 1.365 47974.671 9.266 1.366 49767.625 9.484 1.393 46534.638 9.345 1.362 47199.692 9.480 1.385 48218.854 9.249 1.374 49783.625 9.520 1.379 46539.629 9.220 1.363 47200.696 9.511 1.405 48294.700 9.495 1.396 49979.942 9.342 1.358 46544.650 9.133 1.335 47203.721 9.598 1.407 48296.646 9.501 1.394 50007.917 9.530 1.380 46547.654 9.108 1.341 47204.729 9.616 1.410 48322.608 9.677 1.400 50010.954 9.502 1.378 46550.638 9.113 1.325 47205.729 9.636 1.407 48597.858 9.440 1.368 50034.871 9.082 1.330 46678.979 9.280 1.370 47206.679 9.651 1.419 48631.787 9.555 1.405 50035.875 9.082 1.319 46679.979 9.287 1.375 47211.692 9.725 1.441 48635.787 9.566 1.392 50051.867 9.359 1.364 46703.992 9.351 1.373 47212.692 9.740 1.431 48636.708 9.562 1.394 50052.846 9.389 1.365 46704.979 9.351 1.377 47214.704 9.758 1.427 48638.812 9.555 1.391 50094.737 9.463 1.399 46716.963 9.421 1.392 47221.658 9.654 1.415 48645.787 9.478 1.381 50097.696 9.435 1.384 46720.954 9.403 1.389 47228.646 9.406 1.381 48646.779 9.459 1.375 50101.742 9.360 1.371 46723.963 9.364 1.386 47233.667 9.244 1.357 48649.767 9.411 1.389 50145.633 9.460 1.380 46724.950 9.343 1.402 47234.654 9.226 1.352 48652.754 9.375 1.378 50149.608 9.388 1.367 46728.958 9.238 1.367 47238.642 9.191 1.333 48693.642 9.398 1.389 50151.608 9.363 1.364 46731.950 9.149 1.354 47247.654 9.317 1.382 48697.633 9.420 1.373 50153.608 9.319 1.368 46739.921 9.061 1.337 47250.658 9.380 1.375 48866.975 9.259 1.358 50161.617 9.211 1.337 46740.971 9.057 1.357 47254.646 9.461 1.375 48874.967 9.088 1.355 50172.650 9.175 1.344 46741.946 9.074 1.338 47523.808 9.455 1.383 48888.925 9.408 1.382 50175.621 9.224 1.342 46742.954 9.062 1.360 47524.838 9.457 1.377 48891.904 9.466 1.366 50366.967 9.338 1.362 46747.933 9.104 1.335 47525.787 9.467 1.363 48927.879 9.396 1.340 50425.900 9.386 1.357 46759.933 9.326 1.328 47526.783 9.459 1.373 48976.812 9.384 1.355

detail by means of standard Fourier analysis implemented with Period98 of Sperl (1998).

First, we have calculated the power spectrum of the whole dataset. It is shown in Fig. 2, where the insert shows the window function. One main peak is present at f=0.01604 c/d (A=0.^m14) corresponding to a period of 62.^d345. After a simple prewhitening with this frequency, the power spectrum of the residuals contains a closely separated frequency (f=0.01548 c/d, A=0.^m10). However, it is a direct consequence of the unstable period, since the

Fig. 2. The Fourier spectrum of the whole dataset. The insert shows the window function with the same frequency scale

whole dataset could be fitted neither with a single period nor with a sum of two close periods. Therefore we studied the light curve in four separate subsets (each being about 1000 days long) plotted in the left panels of Fig. 3. We performed similar frequency analysis as for the whole light curve and the results can be summarized as follows:

1. There is a well-defined main peak in every Fourier spectra representing the average cycle length varying around the mean period of ∼65 days. The fitted curves (solid lines in Fig. 3) have the following periods and amplitudes: 1 - 63.^d2, 0.^m2; 2 - 67.^d1, 0.^m13; 3 - 100 d, 0.^m12 (the few data points may result in wrong result); 4 - 65 d, 0.^m15. The typical period uncertainty is about 1 d (except for the third subset).

2. The first subset can be fitted very well with two harmonic components, however the second one is simply due to the variation of the mean brightness. Later data do not support the presence of this false period (∼860 days).

3. The phase diagrams of the individual subsets (right panels of Fig. 3) suggest the average light curve shape to be quite stable. The data were phased with those periods listed above.

4. The prewhitened spectra of the subsets do not contain any other significant peak higher than 0.^m08. We have not tried to use the low-amplitude component(s), because the residual light curves show irregular rather than cyclic behaviour. We feel that when analysing light curves of SR variables the noise level in the frequency spectrum is only partly due to the observational errors and it would be misleading to accept every peaks in the spectrum being much higher than the mean error of the observations (about 0.^m01 in our case). The star itself may grossly increase the noise of the light curve through its erratic behaviour caused, e.g., by the mild chaos affecting the pulsation (see e.g. Buchler & Kolláth 2000). It is well established, e.g. for Mira stars, that radial pulsation alone may produce irregularities in the light and/or radial velocity curves (for instance, through shock wave propagation in the extended atmosphere, Bertschinger & Chevalier 1985, Fox & Wood 1985). The complicated stellar responses on other physical mechanisms (coupling between pulsation and convection, possible departures from the spherical symmetry) prevent drawing a simple and straightforward conclusion on the irregularities. Most recently, Lebzelter et al. (2000) revived the old idea proposed first by Schwarzschild (1975) on the large convective cells introducing some irregularity in the light variation. However, in the case of AI Aur, only speculations can be drawn.

5. The results slightly depend on the selection of the subsets (we have tried different lengths starting from one year to the finally accepted 1000 days); on the other hand, they are strongly affected by the lack of points in the second half of the data.

Considering these points we conclude that the light curve cannot be described with simple sums of harmonic functions, but it has a slowly and apparently irregularly variable characteristic cycle length (instead of period) near 65 days. The period analysis of the b-filter data leads to the same conclusion.

3.2. Colour variations

The conclusions presented so far are typical for semiregular variables (see, e.g. Kiss et al. 1999). The novelty in our results is the presence of colour measurements. To our knowledge, there have not been really long-term (covering tens of cycles) time-series multicolour data in the literature for any semiregular variable star. Although Hipparcos Epoch Photometry (ESA 1997) contains typically 100-200 points for thousands of variables, the limited time span does not permit accurate period determination for red variables. High-precision V-band observations of different SRs were presented, for instance, by Percy et al. 1989, Cristian et al. (1995), Percy et al. (1996) and Lebzelter (1999), but none of these studies dealt with the colour variations.

One of the most extensive time-resolved multicolour photometric surveys was published by Smak (1964), who reported UBV observations of twenty-nine Mira stars and twelve semiregulars during two years, covering typically only one cycle per star. He did not find any clear correlation of the B − V colour and the V brightness for the SR stars. Jerzykiewicz (1984) studied the light and colour variations of HD 157010 (V818 Her), concluding that the star’s UBV magnitudes are effective temperature parameters through the sensitivity of the continuous spectrum and TiO blanketing. Wisse (1981) presented UBV obser-

Fig. 3. The four subsets and the corresponding phase diagrams of AI Aur

vations for 35 SRs for classification purposes. He found that well-defined correlations and anti-correlations exist among the variables, where the phase difference of the V and B −V maxima is either 0 or 0.5. Cadmus et al. (1991), in their study of three SRs, noted only that the colour changes were small compared to the changes in brightness. Narrow-band observations of SR variables in the literature are quite scanty. An interesting application can be found in Wasatonic & Guinan (1998), who used three colors of the Wing near-infrared system to trace the temperature and radius variations of V CVn. These authors measured the highest temperature (from an infrared index) around the maximum light.

The most important feature of our observations is the almost perfectly parallel light and colour curves. This is a characteristic behaviour in radially pulsating variables, where the temperature maximum occurs close to the maximum light. It means that the star appears bluer when it is at maximum light, which is in good agreement what is expected from pure thermal variations driven by pulsation. In the case of FS Comae (SR star with P≈58 d), Torres et al. (1993) reached the opposite conclusion based on UBV data series. The star showed reversed colour changes explained by the fact that B − V colour in FS Com is a molecular absorption index, rather than a temperature indicator. The Strömgren b filter (centered near 4700Å) has a relatively clear spectral region in the center of the passband, but the wings on both sides have moderately-weak TiO absorption, particularly the 2,0 transition with bandhead at 4761Å. The y filter is not so strongly affected, with only the usual Fe, Ti, etc. lines. Unlike the B − V colour, b − y is completely unaffected by the wide TiO bandhead at ∼5167Å. We conclude that the observations imply radial oscillation with dominant thermal effects as the main reason for the light variability. The ∼0.^m1 amplitude of the b − y curve corresponds to a temperature change of <300 K (as estimated from the synthetic colour grids of Kurucz 1993).

3.3. Stellar parameters

Adopting radial pulsation for AI Aur, further constraints can be drawn on the basic stellar parameters. Unfortunately, there is no parallax measurement for AI Aur, thus only spectroscopic parallax or various empirical periodcolour-luminosity relations (e.g. Barthès et al. 1999) can be used to determine its luminosity. We have chosen the former approach, because we wanted to estimate stellar properties without any assumption on its pulsation. In the following we have neglected the interstellar reddening since the observed mean b − y colour (1.^m35) is close to the expected value for an M5 giant star (see Jorissen et al. 1995 for Strömgren photometry of red giants).

The IRAS [12]-[25] colour is −1.^m41. Following the definitions by Kerschbaum & Hron (1992), this means that AI Aur belongs to the “blue” semiregulars (no indication for circumstellar shells, P<150^d, T_{eff} > 3200 K). The infrared brightnesses (K=2.^m71, I=6.^m18), taken from the IRC catalogue (Neugebauer & Leighton 1969), combined with the mean V magnitude imply colour indices V − K=6.^m8 and V − I=3.^m3. The latter value results in a T_{eff} =3420 K using the temperature scale by Dumm & Schild (1998). A less biased estimate can be inferred from twenty M5III-type stars in the sample of Dumm & Schild (1998): ⟨T_{eff} (M5III)⟩=3520±100 K. For an independent check we have used the (V − K)-(710 − 888) and (I − K)-(710 − 888) relations in Alvarez et al. (2000) resulting in T_{eff} =3300 K from their T_{eff} -(710 − 888) calibration. Similarly, one can get a mean radius and mass for the given spectral type of ⟨R⟩ = 123 ± 34R_⊙ and ⟨M⟩ = 2.0 ± 0.8M_⊙. Adopting these spectral type-mass and spectral type-radius values we calculated a pulsational constant Q(= P · √ ρ/ρ_⊙)=0.065^{+0.06}_{−0.03}. Recently, Percy & Parkes (1998) discussed the pulsation modes in smallamplitude red variable stars reaching a conclusion that some stars are likely to pulsate in up to the third overtone mode. Within these frameworks AI Aur seems to pulsate in the fundamental or first overtone mode as is suggested by theoretical models of Xiong et al. (1998) or Ostlie & Cox (1986). The overtone pulsation is favoured by the position of AI Aur in the K-band P-L diagram of long-period variables derived by Bedding & Zijlstra (1998) from Hipparcos parallaxes. For this, we estimated M_K from the V − K colour and M_V -spectral-type calibration of Thé et al. (1990). The resulting M_K = −7.^m5 and log P≈1.8 place AI Aur close to the upper sequence in Fig. 1 of Bedding & Zijlstra (1998), which may be interpreted as a consequence of pulsation in a different mode than that valid for most Mira stars (represented by the lower sequence in Fig. 1 of Bedding & Zijlstra 1998).

Finally, there is an interesting period-gravity relation for a wide range of radially pulsating variable stars presented by Fernie (1995), which can also be used to test the assumption of radial oscillation. The adopted mass and radius give a log g=0.56±0.4 which is coincidentally the same as predicted by Eq. 1 of Fernie (1995). Plotting AI Aur in Fig. 1 of Fernie (1995), its position is as deviant as that of Mira itself suggesting the first overtone to be somewhat more likely. However, the universality of this period-gravity relation has no firm theoretical background and verification; therefore, this comparison should be considered only as a possible hint for the mode of pulsation.

The presented considerations are on the whole consistent with the recent observational and theoretical results regarding the mode of pulsation in Mira and semiregular variables. For example, Feast (1996) found that semiregular variables, independently of their metallicity, pulsate probably in the first overtone mode. Further supporting arguments were listed by Feast (1999). However, semiregulars form a quite heterogeneous group, in which stars may pulsate in the fundamental, or 1st, 2nd or even 3rd overtone mode, as has been clearly demonstrated by Wood et al. (1999). That is why every individual case study has to be performed without any definite preconception.

4. Conclusions

The main results presented in this paper can be summarized as follows:

1. New Strömgren by photometric observations of the semiregular variable AI Aurigae are presented and discussed. The period analysis of the whole light curve confirms the early period determination of 63.9 days. However, the light curve shows typical semiregular behaviour with changing amplitude and cycle length.

2. The b − y colour measurements revealed highly paralel light and colour variations. Since the b−y colour is considerably good temperature indicator (rather than molecule indicator, as is the B − V colour), the phase dependent light and temperature changes resemble classical radially pulsating stars. The observations imply radial oscillation with dominant thermal effects as the main reason for light variability.

3. We estimated the basic stellar parameters, such as the effective temperature (3520±100 K), mean radius (123±34 R_⊙), mass (2.0±0.8 M_⊙). The spectral type-mass amd spectral type-radius values give a pulsational constant of 0.065^{+0.06}_{−0.03}. The results are consistent with radial pulsation in the fundamental or (more likely) first overtone mode. The period-gravity relation of Fernie (1995) also supports this conclusion.

Acknowledgements. This research was supported by the “Bolyai János” Research Scholarship of LLK from the Hungarian Academy of Sciences, Hungarian OTKA Grant #T032258 and Szeged Observatory Foundation. The NASA ADS Abstract Service was used to access data and references. This research has made use of the SIMBAD database, operated at CDS-Strasbourg, France.

References

Alvarez R., Lançon A., Plez B., Wood P.R. 2000, A&A 353, 322 Barthès D., Luri X., Alvarez R., Mennessier M.O. 1999, A&AS 140, 55 Bedding T.R., Zijlstra A.A. 1998, ApJ 506, L47 Bertschinger E., Chevalier R.A. 1985, ApJ 299, 167 Beyer M., 1937, AN 262, 257 Buchler J.R., Kolláth Z. 2000, In: Takeuti M., Sasselov D.

(eds.), Nonlinear Stellar Pulsation, Astrophysics and Space Science Library (AASL), in press Cadmus R.R., Jr., Willson L.A., Sneden C., Mattei J.A. 1991, AJ 101, 1043 Chuadze A.D. 1973, Byull. Abastumanskaya Astrofiz. Obs. 44, 105 Cristian V.C., Donahue R.A., Soon W.H. et al. 1995, PASP 107, 411

Dickinson D.F., Dinger A.S.C 1982, ApJ 254, 136 Dumm T., Schild H. 1998, New Ast. 3, 137 ESA 1997, The Hipparcos and Tycho Catalogues, ESA SP-1200 Feast M.W. 1996, MNRAS 278, 11 Feast M.W. 1999, IAU Symp. 191, 109 Feast M.W., Woolley R., Yilmaz N. 1972, MNRAS 158, 23 Fernie J.D. 1995, AJ 110, 2361 Fox M.W., Wood P.R. 1985, ApJ 297, 455 Jerzykiewicz M. 1984, AcA 34, 353 Jorissen A., Mowlavi N., Sterken C., Manfroid J. 1995, A&A 324, 578 Kholopov P.N., Samus N.N., Frolov M.S., et al. 1985–88, General Catalogue of Variable Stars, 4^{th} edition, “Nauka” Publishing House, Moscow (GCVS4) Kerschbaum F., Hron J. 1992, A&A 263, 97 Kiss L.L., Szatmáry K., Cadmus Jr. R.R., Mattei J.A. 1999, A&A 346, 542 Kiss L.L., Szatmáry K., Szabó Gy., Mattei J.A. 2000, A&AS 145, 283 Koen C., Laney D. 2000, MNRAS 311, 636 Kurucz R.L. 1993, ATLAS9 Stellar Atmosphere Programs and 2 km/s Model Grids, CD-ROM No.13 Lebzelter T. 1999a, A&A 346, 537 Lebzelter T. 1999b, A&A 351, 644 Lebzelter T., Hinkle K.H., Hron J. 1999, A&A 341, 224 Lebzelter T., Kiss L.L., Hinkle K.H. 2000, A&A 361, 167 Lockwood G.W., Thompson D.T. 1986, AJ 92, 976 Lockwood G.W., Skiff B.A., Radick R.R. 1997, ApJ 485, 789 Neugebauer G., Leighton R.B. 1969, Two micron sky survey:

A preliminary Catalogue, Calif. Inst. Technology, NASA Ostlie D.A., Cox A.N. 1986, ApJ 311, 864 Percy J.R., Parkes M. 1998, PASP 110, 1431 Percy J.R., Landis H.J., Milton R.E. 1989, PASP 101, 893 Percy J.R., Desjardnis A., Yu L., Landis H.J. 1996, PASP 108, 139 Smak J. 1964, ApJS 9, 141 Sperl M. 1998, Comm. Astr. Seis. 111 Thé P.S., Thomas D., Christensen C.G., Westerlund B.E. 1990, PASP 102, 565 Torres G., Mazeh T., Latham D.W., Stefanik R.P. 1993, PASP 105, 360 Wasatonic R., Guinan E.F. 1998, IBVS No. 4579 Wisse P.N.J. 1981, A&AS 44, 273 Wood P.R., Alcock C., Allsman R.A. et al. (The MACHO Collaboration) 1999, IAU Symp. 191, 151 Xiong D.R., Deng L., Cheng Q.L. 1998, ApJ 499, 355