arXiv:2404.12559v1 [cs.DS] 19 Apr 2024

An algorithm with a delay of (𝑘Δ) for enumerating connected induced subgraphs of size 𝑘

Chenglong Xiao^a, Chengyong Mao^a and Shanshan Wang^{a,∗}

aDeparment of Computer Science, Shantou University, China

A R T I C L E I N F O

Keywords:

Graph Algorithms Connected Induced Subgraphs Subgraph Enumeration

A B S T R A C T

The problem of enumerating connected subgraphs of a given size in a graph has been extensively studied in recent years. In this short communication, we propose an algorithm with a delay of (𝑘Δ) for enumerating all connected induced subgraphs of size 𝑘 in an undirected graph 𝐺 = (𝑉 , 𝐸), where 𝑘 and Δ are respectively the size of subgraphs and the maximum degree of 𝐺. The proposed algorithm improves upon the current best delay bound (𝑘^2Δ) for the connected induced subgraph enumeration problem in the literature.

1. Introduction

Enumerating the connected induced subgraphs of a given size from graphs has attracted much attention in recent years due to its wide range of applications. The subgraph enumeration algorithms have been used as backbone algorithms in many applications. Such application areas include bioinformatics[1, 2, 3], 6G core networks[4], machine learning[5], social networks[6], and car sharing systems[7], to name a few.

Previous works prove that the upper bound on the number of connected induced subgraphs of size 𝑘 in graph 𝐺 is 𝑛 ⋅^{(𝑒Δ)𝑘}_{(Δ−1)𝑘} , where Δ and 𝑛 are respectively the maximum degree of graph 𝐺 and the number of vertices in 𝐺[8, 9]. Obviously, the number of all connected induced subgraphs of a given size 𝑘 is exponentially large in 𝑘. This also implies that enumerating all connected induced subgraphs of a given size from a graph is a computationally challenging issue. Hence, an efficient algorithm is quite necessary. In the literature, a delay that denotes the maximal time that the algorithms spend between two successive outputs is usually used as a key indicator to evaluate the subgraph enumeration algorithms [10, 11, 12]. In this short communication, we also use the upper bound of the delay for worstcase running time analysis of subgraph enumeration algorithms. Prior to reviewing the related works, we present the formal definition of the subgraph enumeration problem. Note that the definition was already given in [11].

Problem 𝐺𝐸𝑁(𝐺; 𝑘) : Given an undirected graph 𝐺 = (𝑉 , 𝐸), the problem is to enumerate all subsets 𝑋 ⊂ 𝑉 of vertices such that |𝑋| = 𝑘 and the subgraph 𝐺[𝑋] induced on 𝑋 is connected.

Various works have been devoted to the problem 𝐺𝐸𝑁(𝐺; 𝑘) in recent years. Most algorithms for enumerating connected induced subgraphs found in the literature operate in a bottom-up fashion, beginning with a single-vertex subgraph and adding neighboring vertices successively to create larger connected induced subgraphs. Wernicke introduced an algorithm for enumerating all size-𝑘 connected induced subgraphs [1], which labels each vertex and generates larger subgraphs by absorbing vertices from the set 𝑉_{𝐸𝑥𝑡𝑒𝑛𝑠𝑖𝑜𝑛} to smaller subgraphs. These vertices in the set 𝑉_{𝐸𝑥𝑡𝑒𝑛𝑠𝑖𝑜𝑛} must satisfy two conditions: their assigned label must be higher than that of the vertex from which the larger subgraphs originate, and they can only be neighbors of the newly added vertex and not of a vertex in the parent subgraph. More recent work [10] proposed a variant of Wernicke’s algorithm by introducing a new pruning rule, which was found to enumerate all size-𝑘 connected induced subgraphs with a delay of (𝑘^2Δ). This delay bound is currently the best delay bound in the literature.

Another bottom-up algorithm was proposed in [2]. According to the algorithm, the vertex 𝑠 in a set of vertices with the smallest label is termed an anchor vertex. The utmost vertex is the one with the longest shortest path to the anchor vertex, denoted as 𝑢. The algorithm’s objective is to expand subgraphs by incorporating each valid neighbor vertex 𝑣 ⋆ This work was supported in part by the National Natural Science Foundation of China (No.61404069), Scientific Research Project of Colleges and Universities in Guangdong Province (No. 2021ZDZX1027), Guangdong Basic and Applied Basic Research Foundation (No.2022A1515110712 and No.2023A1515010077), and STU Scientific Research Foundation for Talents (No. NTF20016 and No. NTF20017).

∗Corresponding author:Shanshan Wang, email:sswang@stu.edu.cn

ORCID(s):

Chenglong Xiao et al.: Preprint submitted to Elsevier Page 1 of 7

Connected induced subgraph enumeration

that either has a distance farther from 𝑠 relative to the distance between 𝑠 and 𝑢 or has a lexicographically greater value than 𝑢, in cases where 𝑣 and 𝑢 share the same distance to 𝑠.

The aforementioned algorithms fall under the category of bottom-up algorithms as they enumerate connected induced subgraphs by gradually expanding subgraphs. Elbassuoni proposed two algorithms [11], named 𝑅𝑤𝐷 and 𝑅𝑤𝑃 respectively, which are designed specifically for enumerating connected induced subgraphs of size 𝑘 using the supergraph method with reverse search [13]. The algorithms start by creating a connected induced subgraph with 𝑘 vertices and subsequently attempt to traverse every neighboring node in the supergraph by substituting a vertex in the current subgraph with a neighbor vertex. The 𝑅𝑤𝐷 algorithm has a delay of (𝑘 ⋅ 𝑚𝑖𝑛(𝑛 − 𝑘, 𝑘Δ)(𝑘(Δ + log 𝑛)) and requires exponential space (𝑛 + 𝑚 + 𝑘|𝑆|) for storing, where |𝑆| is the number of nodes in super graph 𝑆, 𝑛 is the number of vertices and 𝑚 is the number of edges. The 𝑅𝑤𝑃 algorithm requires only linear space (𝑛 + 𝑚) but with a larger delay of ((𝑘 ⋅ 𝑚𝑖𝑛(𝑛 − 𝑘, 𝑘Δ))^2(𝑘(Δ + log 𝑛)).

A more recent work was proposed in [12]. The authors introduced a new neighborhood definition that two nodes (𝑋 and 𝑌 ) in the supergraph are considered neighbors only if they share exactly 𝑘 − 1 vertices and the induced subgraph of their intersection (𝑋 ∩ 𝑌 ) is also connected. Three algorithms were proposed based on the new neighborhood. Two of the three algorithms slightly improve upon the current best delay bound (𝑘^2Δ)[10] in the case

𝑘 >^{𝑛 log Δ−log 𝑛−Δ+} √ 𝑛 log 𝑛 log Δ log Δ and 𝑘 > 𝑛^2

𝑛+Δ respectively at the expense of exponential space.

2. The proposed algorithm

In this section, we first present some necessary notations and preliminaries. Let 𝐺 = (𝑉 , 𝐸) be an undirected graph consisting of a vertex set 𝑉 = {𝑣_1, 𝑣_2..., 𝑣_𝑛} and a edge set 𝐸 ⊆ 𝑉 × 𝑉 . The size of a subgraph denotes the number of vertices in the subgraph. 𝐺(𝑈) stands for the subgraph of 𝐺 induced by a vertex set 𝑈 ⊆ 𝑉 . The neighbors set of a vertex 𝑣 is expressed as 𝑁(𝑣) ∶= {𝑢|{𝑢, 𝑣} ∈ 𝐸}. The neighbor set of a connected set 𝑆 is denoted by 𝑁(𝑆) ∶= ∪_{𝑣∈𝑆} 𝑁(𝑣) ⧵ 𝑆. The delay of the enumeration algorithm is defined as the maximum amount of time spent between successive solution outputs. In the rest of the communication, the size-𝑘 subgraph refers to the connected induced subgraph of size 𝑘.

The main idea of the previous algorithms proposed in [1, 10, 15] incrementally expand a connected vertex set 𝑆 (|𝑆| < 𝑘) by adding a vertex 𝑣 from 𝑁(𝑆), and then the recursive branches based on 𝑣 is in charge of enumerating all the size-𝑘 subgraphs containing the vertex 𝑣 and 𝑆. 𝑣 is then implicitly or explicitly marked as a forbidden vertex that can not be included in the following iterations and recursions based on remaining neighbors. In such a way, each size-𝑘 subgraph is enumerated exactly once. The delay of these algorithms is (𝑘^2Δ). In this work, we propose an algorithm that expands the subgraphs by absorbing the neighbors in an opposite way. Given a connected vertex set 𝑆 (|𝑆| < 𝑘), the proposed algorithm enlarges 𝑆 by adding a vertex 𝑣 from 𝑁(𝑆) in a depth-first search manner, meanwhile the rest of unvisited vertices in 𝑁(𝑆) are marked as closed vertices that cannot be included for the recursive branches based on 𝑣. For the next vertex 𝑢 in 𝑁(𝑆), we enumerate all the connected vertex set containing 𝑆 and 𝑢, and the unvisited vertices in 𝑁(𝑆)∖{𝑢, 𝑣} are marked as closed vertices in the following recursions. Furthermore, to avoid redundant searching, the visited vertices are recorded in an array until a new solution is found. This process is repeatedly carried out until all the vertices in 𝑁(𝑆) are visited. The proposed algorithm has a delay of (𝑘Δ).

Similar to previous works, we assume that the input undirected graph 𝐺(𝑉 , 𝐸) is connected in this work; otherwise, we can deal with each connected component individually. Algorithm 1 presents the pseudo-code^1. The algorithm receives an undirected graph as input and generates all connected induced subgraphs of size 𝑘 as outputs. The algorithm starts by visiting each vertex 𝑣 in 𝑉 and adding 𝑣 to form a one-vertex subgraph in lines 2,3. Then, the neighbors of 𝑣 are added to the end of a global array 𝐹 (initially 𝐹 is an empty array) and marked as vertices to be visited one by one in the following recursion (|𝑁(𝑣)∖𝐹 | indicates the number of vertices to be visited from the end of 𝐹 , lines 4,5). We call the recursive function 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) to enumerate all the size-𝑘 subgraphs containing 𝑣, then 𝑣 is marked as a closed vertex by adding it to 𝐹 before entering the following iterations (line 6). If the number of unvisited vertices is less than 𝑘, the algorithm terminates (lines 8,9). We assume that the vertices in 𝑉 are visited in reverse order of any depth-first search. This is to ensure that the current vertex 𝑣 is a leaf vertex of the remaining unvisited vertices in 𝑉 and the remaining vertices set that excludes 𝑣 and previously visited vertices is always a connected set.

In 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟), we visit the last 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟 vertices in 𝐹 one by one, remove each vertex from the end of 𝐹 and add it to the end of a global array 𝑆 (lines 20,21). A global array 𝑇 is used to temporarily record all the

1The implementation of the proposed algorithm is available at https://github.com/miningsubgraphs/algorithms

Chenglong Xiao et al.: Preprint submitted to Elsevier Page 2 of 7

Connected induced subgraph enumeration

Algorithm 1: The Proposed Algorithm

Input: An undirected graph 𝐺 = (𝑉 , 𝐸) Output: A set of enumerated connected induced subgraphs of size 𝑘 /* 𝐹 : The set is composed of two parts: the last 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟 neighbor vertices in 𝐹 are opened for visiting one by one, while the other neighbor vertices in 𝐹 are closed; 𝑁: The set of neighbor vertices that are already visited and will be opened for visiting when a 𝑘-subgraph is found. 𝑇 : The set of traversed vertices. */ 1 Procedure 𝑀𝑎𝑖𝑛(𝐺(𝑉 , 𝐸))

/* the vertices in 𝑉 are visited in reverse order of any depth-first search. */ 2 for each vertex 𝑣 ∈ 𝑉 do 3 𝑆 = {𝑣}; 4 𝐹 = 𝑁(𝑣)∖𝐹 ;

5 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , |𝑁(𝑣)∖𝐹 |);

6 𝐹 = 𝐹 ∪ {𝑣}; ⊳ add 𝑣 to the end of 𝐹 as a permanently closed vertex; 7 restore 𝑁;

8 if |𝑉 | − |𝐹 | < 𝑘 then 9 break;

/* recursively enumerate all the connected induced subgraphs of size 𝑘. */ 10 Procedure 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) 11 hasSolution = False; 12 if |𝑆| = 𝑘 then 13 output 𝑆; 14 return True;

15 else if |𝑆| + |𝑇 | = 𝑘 then 16 output 𝑆 ∪ 𝑇 ;

17 𝑇 = ∅; ⊳ remove all the vertices from 𝑇 ; 18 hasSolution = True;

19 for each vertex 𝑢 of the last 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟 vertices in 𝐹 do 20 𝐹 = 𝐹 ∖{𝑢}; ⊳ delete the last vertex 𝑢 at the end of 𝐹 ; 21 𝑆 = 𝑆 ∪ {𝑢}; 22 𝑛𝑒𝑤𝐹 𝑁𝑢𝑚𝑏𝑒𝑟 = 0; 23 if |𝑆| < 𝑘 then 24 for each vertex 𝑣 ∈ 𝑁(𝑢)∖𝑆∖𝑁∖𝐹 do 25 if 𝑣 ∈ 𝑇 then 26 𝑁 = 𝑁 ∪ {𝑣}; ⊳ add 𝑣 to the end of 𝑁;

27 else 28 𝐹 = 𝐹 ∪ {𝑣}; 29 newFNumber++;

30 if ℎ𝑎𝑠𝑆𝑜𝑙𝑢𝑡𝑖𝑜𝑛 = 𝑇 𝑟𝑢𝑒 then 31 𝐹 = 𝐹 ∪ 𝑁; ⊳ remove every vertex from the end of 𝑁 and add it to the end of 𝐹 ; 32 𝑛𝑒𝑤𝐹 𝑁𝑢𝑚𝑏𝑒𝑟 = 𝑛𝑒𝑤𝐹 𝑁𝑢𝑚𝑏𝑒𝑟 + |𝑁|;

33 if 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑛𝑒𝑤𝐹 𝑁𝑢𝑚𝑏𝑒𝑟) = True then 34 hasSolution = True;

35 else 36 𝑇 = 𝑇 ∪ {𝑢};

37 restore 𝑆 and 𝑁; 38 𝑁 = 𝑁 ∪ {𝑢};

39 return hasSolution;

traversed vertices (not only the visited neighbors) during previous iterations and their recursions between two solutions. If the recursion called from current enumeration node do not lead to finding a 𝑘-subgraph, we add the visited vertex to 𝑇 (line 36). If a 𝑘-subgraph is found, we clear 𝑇 (|𝑆| + |𝑇 | = 𝑘, line 17). In other words, the algorithm continues to visit new vertices until the number of all the visited vertices involved in 𝑆 and 𝑇 is 𝑘. If the size of 𝑆 is less than 𝑘, for vertices in 𝑁(𝑢), we only visit the vertices that are not in 𝑆,𝑁, and 𝐹 (line 24). If the neighbor vertex 𝑣 is in 𝑇 , we added it to the end of a global array 𝑁 in line 26, where 𝑁 records the set of neighbor vertices that are already visited. If 𝑣 is not traversed in the previous iterations and their recursions, we added it to the end of 𝐹 (line 28). Line 11 initializes a Boolean tag hasSolution with False at the beginning of each recursive call. When at least one recursive

Chenglong Xiao et al.: Preprint submitted to Elsevier Page 3 of 7

Connected induced subgraph enumeration

Figure 1: Enumeration tree of the proposed algorithm for enumerating all connected induced subgraphs of size 5.(a) a connected graph with 6 vertices (b) the enumeration tree on the sample graph. Dashed rectangles of the tree indicate enumeration nodes. The enumerated connected induced subgraphs of size 5 are highlighted in italics. The underline of the vertices in 𝐹 denotes that these vertices will be visited in the child recursive call.

call finds a 𝑘-subgraph, the Boolean variable ℎ𝑎𝑠𝑆𝑜𝑙𝑢𝑡𝑖𝑜𝑛 is set to True in line 34. If a solution is found, we remove every vertex from the end of 𝑁 and append it to the end of 𝐹 (line 31). We may find a solution in two cases. The first case is when the number of vertices added along the enumeration tree path is 𝑘 (line 12). The second case is when the number of vertices added along the enumeration tree path and vertices traversed during previous iterations and their recursions is 𝑘 (line 15).

Now, we illustrate how the proposed algorithm works by presenting an example of the enumeration tree of the algorithm on a connected graph with 6 vertices when the size of connected induced subgraphs is set to 5 (Figure 1). In the example, the vertices of the connected graph are stored in a depth-first search order. The algorithm visits the vertices in 𝑉 according to the reverse order of the depth-first search. Thus, we visit the vertex 5 first, and the neighbors of the vertex 5 are added to the end of 𝐹 and these neighbors are marked as the last 3 (𝑓 𝑁𝑢𝑚𝑏𝑒𝑟 = 3) vertices to be visited in the child recursive call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒({5}, {}, {1, 3, 4}, 3). Then, the call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒({5}, {}, {1, 3, 4}, 3) and its recursive calls are in charge of enumerating all the size-𝑘 subgraphs containing the vertex 5. After these enumerations, the vertex 5 is added to 𝐹 as a closed vertex that cannot be included in the following iterations and their recursive calls. Note that we move the last three added vertices from 𝐹 to 𝑁 inside the call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒({5}, {}, {1, 3, 4}, 3). The restoration of 𝐹 is not needed and we can add the vertex 5 to 𝐹 directly. Next, the algorithm visits the vertex 4 in 𝑚𝑎𝑖𝑛(), and the neighbor vertices of it are added to the end of 𝐹 . The call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒({4}, {}, {5, 2, 3}, 2) and its recursive calls are in charge of enumerating all the size-𝑘 subgraphs containing the vertex 4 and excluding the vertex 5. Until now, the vertex 5 and the vertex 4 cannot be included anymore. This indicates that the size of the remaining vertices in 𝐺 is less than 𝑘 = 5, thus the algorithm terminates.

In the process of enumerating all the size-𝑘 subgraphs containing the vertex 5, the algorithm visits the neighbor vertices of the current subgraph 𝑆 in a depth-first search way. For instance, starting from the enumeration node [{5}, {}, {1, 3, 4}], we visit the vertex 4 that is at the end of 𝐹 and add it to 𝑆 first. Then, the neighbor vertex 2 of the vertex 4 is visited and added to 𝑆. When we arrive at the enumeration node [{5, 4, 2}, {}, {1, 3}], the algorithm returns as there is no more vertices that are marked as to be visited in 𝐹 . In the implementation, we use a global Boolean array 𝐵 with a fixed length of |𝑉 | to record the existence of the vertices in 𝑆, 𝑁, and 𝐹 , where each array index of 𝐵 corresponds to a vertex and the true value denotes that the vertex is in 𝑆, 𝑁 or 𝐹 . As an example, for

Chenglong Xiao et al.: Preprint submitted to Elsevier Page 4 of 7

Connected induced subgraph enumeration

the enumeration node [{5, 4, 2}, {}, {1, 3}], the values of 𝐵 are {𝑓 𝑎𝑙𝑠𝑒, 𝑡𝑟𝑢𝑒, 𝑡𝑟𝑢𝑒, 𝑡𝑟𝑢𝑒, 𝑡𝑟𝑢𝑒, 𝑡𝑟𝑢𝑒}. Since no solution is found, the algorithm returns to the parent enumeration node and adds the visited vertex to the end of a global array 𝑇 (line 36). 𝑇 is used to record the vertices that are already visited until a solution is found. This can avoid repeatedly searching the explored vertices. In other words, the algorithm can continue to explore unvisited neighbor vertices using 𝑇 . Similar to 𝐵, we also use a global Boolean array to represent the existences of the vertices in 𝑇 (line 25). When the algorithm returns to the enumeration node [{5}, {}, {1, 3, 4}] and visits the vertex 1 in 𝐹 , we have 𝑆 = {5, 1}. As the neighbor vertex 2 was already explored and stored in 𝑇 , we add it to the end of 𝑁 = {4, 3}. Thus, we have 𝑁 = {4, 3, 2}. The neighbor vertex 0 is not in 𝑇 , we add it to the end of 𝐹 . In the following child recursive call, we have |𝑆 ∪ 𝑇 | = 5 and output 𝑆 ∪ 𝑇 (𝑇 is then cleared by removing all the elements in it). The local variable ℎ𝑎𝑠𝑆𝑜𝑙𝑢𝑡𝑖𝑜𝑛 is set to true in this enumeration node. Then, we continue to visit the vertex 0 in 𝐹 . We remove it from 𝐹 and add it to 𝑆. As ℎ𝑎𝑠𝑆𝑜𝑙𝑢𝑡𝑖𝑜𝑛 is true, we remove every element from 𝑁 = {4, 3, 2} and add it to 𝐹 (line 31). Thus, we have 𝑁 = {} and 𝐹 = {2, 3, 4} with 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟 = 3. The algorithm continues the aforementioned processes until the last solution 𝑆 = {5, 1, 0, 2, 3} is found. Then, the algorithm moves to find all the 𝑘-subgraphs containing the vertex 4 and excluding the vertex 5. It can be seen that each call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) in 𝑚𝑎𝑖𝑛() always terminates with a solution.

The correctness, the delay, and the space of the proposed algorithm are provided and proven respectively as follows.

Lemma 1. Let 𝐺(𝑉 , 𝐸) be a connected undirected graph, then the proposed algorithm correctly outputs all connected induced subgraphs of size 𝑘 from graph 𝐺.

Proof. To prove the correctness of the proposed algorithm, it is sufficient to prove that the proposed algorithm can enumerate each connected induced subgraph of size 𝑘, and each connected induced subgraph of size 𝑘 is enumerated at most once.

Firstly, we show that if 𝐺(𝐶) is a connected induced subgraph of size 𝑘, then 𝐶 is outputted by the proposed algorithm at least once. It is straightforward that for every connected set 𝑆 ⊂ 𝐶 ⊆ 𝑉 , there exists at least a vertex 𝑢 ∈ 𝐶∖𝑆 is a neighbor vertex of 𝑆. Suppose that the vertex 𝑣 in 𝐶 is the first vertex in reverse order of depth-first search in 𝑉 . Then, we call 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) to enumerate all the connected subgraphs containing 𝑆 = {𝑣}. Since we can find at least one neighbor vertex 𝑢 of 𝑆 (𝑢 ∈ 𝐶∖𝑆) to enlarge 𝑆 by calling 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) (𝑢 can be added to either 𝑆 or 𝑇 ), we will finally get 𝐶 by adding such neighbor vertices.

Secondly, we prove that if 𝐺(𝐶) is a connected induced subgraph of size 𝑘, the proposed approach outputs 𝐶 at most once. We prove this through contradiction. We suppose that 𝐶 is enumerated twice (𝐶^′ 𝑎𝑛𝑑 𝐶^{′′}). According to the enumeration procedure, a size-𝑘 subgraph can be outputted in two cases. One is when |𝑆| = 𝑘. The other one is when |𝑆| + |𝑇 | = 𝑘. The first case outputs a size-𝑘 subgraph at the leaf node. The second case may output a size-𝑘 subgraph at an inner node of the enumeration path. We can consider the second case as a virtual enumeration path with a single branch, where we start from 𝑆 and add a neighbor vertex 𝑣 ∈ 𝑇 ∖𝑆 to 𝑆 in each enumeration node until a size-𝑘 subgraph is found at a leaf node. Now, we can further assume 𝐶^′ and 𝐶^{′′} are enumerated by two enumeration paths, 𝑃_1 and 𝑃_2, respectively. If we track the reverse direction of 𝑃_1 and 𝑃_2, they should eventually converge at a single enumeration node 𝑇_𝑖. In 𝑇_𝑖, the right enumeration path of the two enumeration paths produces all connected induced subgraph(s) that includes a vertex 𝑣, while the left enumeration path produces all connected induced subgraph(s) that excludes 𝑣. Thus, 𝐶^′ ≠ 𝐶^{′′}, we arrive at a contradiction.

Lemma 2. The delay of the proposed algorithm is 𝑂(𝑘Δ), where Δ is the maximum degree of 𝐺.

Proof. Firstly, we show that the proposed algorithm requires at most 𝑘 calls of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) to find a new solution. In 𝑚𝑎𝑖𝑛(), we visit each vertex 𝑣 from 𝑉 in reverse order of any depth-first search. Then, we call 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) to enumerate all the solutions containing 𝑣. The vertex 𝑣 is then marked as a closed vertex that cannot be included in the subsequent calls of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) in 𝑚𝑎𝑖𝑛(). Since we visit the vertices in 𝑉 in reverse order of depth-first search, we can ensure that the remaining vertices (𝑉 ∖𝐹 ) are always connected. If the size of the remaining vertices is less than 𝑘, we terminate the enumeration. Otherwise, we know that there is at least one 𝑘-subgraph in the remaining vertices. Thus, each call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) in 𝑚𝑎𝑖𝑛() leads to at least one solution. Let 𝑇_𝑖 be an enumeration node in the enumeration tree of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟), we visit and remove every vertex 𝑢 of the last 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟 vertices in 𝐹 and enumerate all the solutions containing

Chenglong Xiao et al.: Preprint submitted to Elsevier Page 5 of 7

Connected induced subgraph enumeration

𝑢. In the enumeration of all the solutions containing 𝑢, the remaining vertices in 𝐹 are marked as closed vertices that cannot be included. For the subsequent recursive calls in 𝑇_𝑖, 𝑢 is considered as a neighbor vertex that can be included. Hence, it is easy to know that if a recursive call in 𝑇_𝑖 finds a solution, then all the subsequent recursive calls in 𝑇_𝑖 can also find a solution. This implies that 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) always terminates with a solution. Now, it is sufficient to show that we require at most 𝑘 calls of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) for finding the first solution and spending between two consecutive solutions. Inside each call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟), exactly one vertex is added to either 𝑆 or 𝑇 . Thus, we can find the first solution or another solution with at most 𝑘 calls of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟).

Secondly, we demonstrate the time required in each call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) without recursive calls. It is clear that each connected induced subgraph of size 𝑘 can be outputted in (𝑘) time (lines 13, 16). As the length of 𝑇 is at most 𝑘, we can remove all the vertices from 𝑇 in (𝑘) time (line 17). The updates of 𝐹 and 𝑆 in each recursive call require (1) time (lines 20,21,26,28). Inside each recursive call, we check that each neighbor vertex of 𝑢 is not in 𝑆, 𝑁, and 𝐹 (line 24). To ensure (1) time of each check, we can use a global Boolean array with a fixed length of |𝑉 | to record the existences of the vertices in 𝑆, 𝑁 or 𝐹 , where each array index of 𝐵 corresponds to a vertex and its true value represents the vertex is in either 𝑆, 𝑁 or 𝐹 . Similarly, we also use a global Boolean array with a fixed length of |𝑉 | to record the existences of the vertices in 𝑇 . We remove every vertex from the end of 𝑁 and add it to the end of 𝐹 when a solution is found in line 31. It can be seen that these operations can be only called once between two consecutive solutions. As 𝑁 stores parts of vertices in 𝑁(𝑆) and |𝑁(𝑆)| ≤ 𝑘Δ, the time required for removing the vertices from 𝑁 to 𝐹 is at most (𝑘Δ). Since we have updated 𝑆, 𝑁, and 𝐹 , we need to restore these three arrays before returning to the parent enumeration node. To restore 𝑆, we only need (1) time to remove the last vertex from the end of it. For 𝐹 , all vertices added to 𝐹 will be moved to 𝑁 by the child recursive call, the restoration of 𝐹 is not required. To restore 𝑁, we only need to remove the added vertices (𝑁(𝑢)∖𝑆∖𝑁∖𝐹 ) from the end of 𝑁. As |𝑁(𝑢)| ≤ Δ, the time for restoring 𝑁 in 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) is at most (Δ). Finally, we can conclude that the delay of the proposed algorithm is (𝑘Δ).

Lemma 3. The space complexity of the proposed algorithm is (|𝑉 | + |𝐸|), where |𝑉 | is the number of vertices in 𝐺, and |𝐸| is the number of edges in 𝐺.

Proof. It is clear that the space required for storing 𝐺 is |𝑉 | + |𝐸|. According to the data structures used in the implementation, we know that 𝑆, 𝑁, and 𝐹 are declared as global arrays. 𝑆 stores the set of vertices in the subgraph, and its maximum size is 𝑘. 𝑁 and 𝐹 store parts of the neighbor vertices of 𝑆 (𝑁 ∪ 𝐹 = 𝑁(𝑆) 𝑎𝑛𝑑 𝑁 ∩ 𝐹 = ∅). As |𝑁(𝑆)| ≤ 𝑚𝑖𝑛(𝑘Δ, |𝑉 |), then the maximum size of 𝑁 and 𝐹 is |𝑉 |. In the proposed algorithm, we also use a global array 𝑇 to record the vertices that are visited between two solutions. As we add at most one vertex to 𝑇 inside each call of 𝐸𝑛𝑢𝑚𝑒𝑟𝑎𝑡𝑒(𝑆, 𝑁, 𝐹 , 𝑓 𝑁𝑢𝑚𝑏𝑒𝑟) and we require at most 𝑘 calls to find a new solution, the maximum size of 𝑇 is 𝑘. In addition, a global Boolean array 𝐵 is used as an auxiliary array to check if a neighbor vertex is in 𝑆, 𝑁, and 𝐹 . The length of 𝐵 is fixed to the size of the original graph 𝐺. The length of the auxiliary Boolean array for 𝑇 is also with a fixed length of |𝑉 |. Therefore, the space complexity of the proposed algorithm is (|𝑉 | + |𝐸|).

3. Conclusion

In this work, aiming at enumerating all connected induced subgraphs of a given size 𝑘, we presented a new algorithm with a delay of (𝑘Δ) and a space of (|𝑉 | + |𝐸|). The delay bound of the proposed algorithm improves upon the current best delay bound of (𝑘^2Δ). To the best of our knowledge, the proposed algorithm is the first algorithm with a delay of (𝑘Δ) for the subgraph enumeration problem in the literature.

4. Acknowledgement

The authors would like to thank the various grants from the National Natural Science Foundation of China (No. 61404069), Scientific Research Project of Colleges and Universities in Guangdong Province (No. 2021ZDZX1027), Guangdong Basic and Applied Basic Research Foundation (2022A1515110712 and 2023A1515010077), and STU Scientific Research Foundation for Talents (No. NTF20016 and No. NTF20017).

Chenglong Xiao et al.: Preprint submitted to Elsevier Page 6 of 7

Connected induced subgraph enumeration

References

[1] Wernicke S. Efficient detection of network motifs. IEEE/ACM Transactions on Computational Biology and Bioinformatics, 2006, 3:347-359. [2] Alokshiya M, Salem S, Abed F. A linear delay algorithm for enumerating all connected induced subgraphs. BMC Bioinformatics, 2019, 20- S(319):1-11.

[3] Salem S, Alokshiya M, Hasan M.A. RASMA: a reverse search algorithm for mining maximal frequent subgraphs. BioData Mining, 2021, 14:19. [4] Mogyorósi F, Babarczi P, Zerwas J, Blenk A and Pašić A. Resilient Control Plane Design for Virtualized 6G Core Networks. IEEE Transactions on Network and Service Management, 2022, 19(3):2453-2467.

[5] Khetan A. Spectrum Estimation from a Few Entries. Journal of Machine Learning Research, 2019, 20 (2019): 1-55. [6] Rao G, Li D, Wang Y, Chen W, Zhou C, Zhu Y. Maximizing the influence with k-grouping constraint. Information Sciences, 2023, 629: 204-221. [7] Bražėnas M, Valakevičius E. Investigation of continuous time Markov chain approximate transient analysis via subgraph generation in the case of a car sharing system model. Expert Systems with Applications, 2024, 237: 121595.

[8] R. Uehara. The number of connected components in graphs and its applications. Manuscript. URL:

http://citeseerx.ist.psu.edu/viewdoc/summary?doi=10.1.1.44.5362.

[9] Bollobás, B., 2006. The Art of Mathematics - Coffee Time in Memphis. Cambridge University Press.

[10] Komusiewicz C , Sommer F. Enumerating connected induced subgraphs: Improved delay and experimental comparison. Discrete Applied Mathematics, 2021, 303: 262-282.

[11] Elbassioni K. M. A polynomial delay algorithm for generating connected induced subgraphs of a given cardinality. Journal of Graph Algorithms and Applications, 2015, 19:273-280.

[12] Wang S, Xiao C, Casseau E. Algorithms with improved delay for enumerating connected induced subgraphs of a large cardinality. Information Processing Letters, 2024, 183: 106425.

[13] Avis D and Fukuda K. Reverse search for enumeration. Discrete Applied Mathematics, 1996, 65(1-3):21-46. [14] Tarjan R. Depth-first search and linear graph algorithms. SIAM journal on computing,1972, 1(2):146-160. [15] Wang S, Xiao C. Novel algorithms for efficient mining of connected induced subgraphs of a given cardinality. arxiv preprint arxiv:2112.07197 (2021).

Chenglong Xiao et al.: Preprint submitted to Elsevier Page 7 of 7