arXiv:2301.13763v1 [astro-ph.SR] 31 Jan 2023

Manuscript for Revista Mexicana de Astronomía y Astrofísica (2007)

PHOTOMERIC ANALYSIS OF ECLIPSING BINARIES: VY UMI, RU UMI AND GSC 04364-00648

V. Kudak,^1 Š.Parimucha,^2 V. Perig,^1 and P. Gajdoš^2 Draft version: February 1, 2023

RESUMEN

ABSTRACT We present the photometric analysis of BVR and TESS light curves of three eclipsing binaries (RU UMi and purely studied VY UMi, GSC 04364-00648), together with their period changes considering archival data and new minima times from our and TESS observations. For the first time we detected wave-like variations with low-amplitude in O − C residua of RU UMi, which can be interpreted as a consequence of the light-time effect caused by the 3rd invisible component with period 7370 days. Period increase with rate 2.56(9)×10^{−7} d/yr^{−1} detected in the VY UMi system corresponds to mass transfer from the secondary to the primary component. For GSC 04364-00648 binary system we find some quadratic changes on the O − C diagram, which corresponds to a period decrease with a high rate of −2.26(5) × 10^{−5} d/yr^{−1}. We cannot assumptions about their nature, mainly due to short time of observation and uneven coverage of O − C diagram. We also determined the absolute parameter of their components using the photometric solution and GAIA distances.

Key Words: Binaries: close — Binaries: eclipsing — Stars: Mass loss — Stars: individual (RU UMi, VY UMi, GSC 04364-00648)

1. INTRODUCTION

Eclipsing binary stars are systems, where the components are mutually obscured for the observer during their motion around a common centre of mass. It is a very important group of variable stars with specific and wellrecognized light-curves, where their shapes depend on the physical properties of the components and geometrical configuration (Hilditch 2001; Prša 2019; Čokina et al. 2021).

Analysis of light-curves of eclipsing binaries can reveal, among other aspects, the relative dimensions of stars, their effective temperatures, orbital inclination, the eccentricity of the orbit, and potential spots on their surfaces. Together with radial velocities obtained from spectroscopic observations, we can determine the masses of the components, their radii and luminosities, and the dimension of their orbit. These parameters can be also estimated if we know the distance and the amount of interstellar extinction to star.

1Laboratory of space researches, Uzhhorod National University, Uzhhorod, Ukraine. 2Institute of Physics, Faculty of Science, P.J. Šafárik University, Košice, Slovakia. 1

The shapes of components in binary stars are described by Roche geometry (e.g Prša 2019). According to this, three configurations of binaries are possible, detached (both components are in their Roche lobes), semidetached (one component fills its Roche lobe), and contact, where both components overfill their Roche lobes. All this is reflected in the light-curves and also has other observational consequences, like a period change due to mass transfer, angular momentum loss (e.g. Yang et al. 2009) and/or magnetic braking (Applegate 1992).

We now know more than 500 000 eclipsing binaries (Watson et al. 2006), and in the era of large photometric surveys (e.g. Ivezić et al. 2019) one can expect the discovery of several million new eclipsing binaries. But only a very small fraction of them (less than 1%) have calculated parameters. It is a big challenge for data analysis in the near future.

In this paper, we want to make a small contribution to the knowledge of eclipsing binary stars by photometry study and period analysis of three eclipsing binaries, two of them were not studied in detail up to now in literature, while for 3rd we indicate the possible presence of 3rd body according to the O − C diagram.

RU UMi (TYC 4402-504-1) was for the first time mentioned as eclipsing binary of Algol type by Strohmeier & Bauernfeind (1968). They analysed sky-patrol plates taken from 1931 through 1959. Wood (1971) presented the first photometric solution and concluded, that both stars are oversize for their masses and the object may be a contact system of W UMa type. Other photometric solutions by Nha (1973) and de Bernardi & Scaltriti (1977) suggested that the system was close to contact, while Kaluzny (1985) modeled previous data and concluded that the system was quite close to a semidetached configuration. It was supported by Okazaki et al. (1988), Bell et al. (1993) and Zhu et al. (2006). The radial velocities for the primary component were published by Okazaki et al. (1988) and for both components by Maxted & Hilditch (1996). They found that the mass ratios in the range 0.32 < q < 0.40 provide a good solution to the light curves.

Zhu et al. (2006) published O − C period analysis of up to date minima times observations and suggested a continuous period decrease at a rate dP/dt = −1.72 × 10^{−8} d yr^{−1} caused by a transfer of the matter from the secondary to the primary component. Lee et al. (2008) explained the secular period decrease by angular momentum loss (AML) due to magnetic braking alone or more convincingly by a combination of AML and mass transfer from the less massive secondary to the more massive primary. The distance to the system is 283.0±1.2 pc (Babusiaux et al. 2022). RU UMi was observed in 5 sectors during TESS mission (Ricker 2014).

VY UMi (GSC 04568-00313) was discovered as variable star by Strohmeier (1958). The first ephemeris for this eclipsing binary was published by Otero & Dubovsky (2004). The distance to the system is 164.5±0.3 pc (Babusiaux et al. 2022). VY UMi has no published photometric solution of the light-curve and neither period analysis up to now. Meanwhile, the object was observed in 13 sectors during the TESS mission, so it is an interesting object for our research.

GSC 04364-00648 (TYC 4364-648-1) was mentioned as variable in Widefield Infrared Survey Explorer (WISE) Catalog of Periodic Variable Stars by Chen et al. (2018) with period 0.8628506 d. The distance to the system was determined to be 512.5±4.8 pc (Babusiaux et al. 2022). The system has observations from 3 TESS mission sectors. No other analysis of this eclipsing binary was published.

2. OBSERVATIONS AND DATA REDUCTION

All new CCD observations of eclipsing binary systems presented in this work were carried out at the Derenivka Observatory of Uzhhorod National University, Ukraine (Lat: 48.563 N; Long: 22.453 E, MPC code K99) and Kolonica Astronomical Observatory (KAO) of the P.J. Šafárik University, Košice, Slovakia (Lat: 48.950 N; Lon: 22.266 E). Measurements were collected from March 2021 to October 2021.

In Derenivka Observatory, we have used a 400 mm Newton-type telescope with a focal ratio of f/4.4 equipped with FLI PL9000 CCD camera (array 3056×3056, pixel size 12μm) with BV R Bessel photometric filters. The field of view of such configuration of the system is 1.21^∘ × 1.21^∘. Observations at KAO were made by PlaneWave CDK20 telescope with a diameter of main mirror 508 mm and a focal ratio of f/6.8 at the Cassegrain focus. The telescope is equipped with a G4-16000 CCD camera (array 4096×4096, pixel size 9μm) with UBV RI Bessel photometric filters. The field of view of the system is 37^′ × 37^′. The detailed journal of our CCD observation is given in Table 1.

The CCD images were calibrated (bias and dark subtraction, flat-field correction) utilizing the software package CoLiTecVS (Savanevych et al. 2017; Parimucha et al. 2019). This package was also used for aperture photometry, calculation of differential magnitudes according to artificial comparison star as well as calibration to the standard photometric system. The comparison stars used for the determination of artificial ones were selected manually according to the similarity of the studied binaries (brightness, distance in the sky). This approach significantly improves the quality of photometric measurements. Due to not a stable night-to-night observing conditions, the average precision of our measurements varied ∼0.01-0.05 mag in V and R filters and ∼0.03-0.08 mag in B filter. The comparison stars used in our study are listed in Table 2, together with their magnitudes from the NOMAD catalogue (Zacharias et al. 2004, 2005).

The resulting light-curves of all eclipsing binaries are depicted in Fig. 1. The light-curves were phased according to ephemerides determined from O−C variations analyzed in the next chapter. Magnitudes on the Fig. 1 have tiny systematic shifts according to APASS magnitudes that are compared to the level of observation errors.

4 KUDAK ET AL.

TABLE 1 THE JOURNAL OF OUR CCD OBSERVATIONS.

System Date Time(UT) Phase^a Filters RU UMi Mar 03 21 17:24 - 23:05 0.646 - 0.097 BV R Sep 06 21 20:43 - 01:00 0.151 - 0.490 BV R Sep 09 21 17:53 - 00:48 0.640 - 0.190 BV R Sep 12 21 17:53 - 21:49 0.356 - 0.669 BV R VY UMi Mar 24 21 18:36 - 03:35 0.729 - 0.878 BV R Oct 28 21 16:47 - 01:12 0.430 - 0.509 BV R Oct 29 21^b 18:50 - 03:03 0.767 - 0.819 BV R GSC Apr 04 21 18:28 - 03:02 0.469 - 0.883 BV R 04364-00648 Apr 08 21 18:27 - 23:34 0.104 - 0.351 BV R Apr 10 21 18:28 - 02:47 0.422 - 0.824 BV R May 08 21 19:11 - 01:52 0.908 - 0.230 BV R Jun 08 21 20:00 - 00:51 0.875 - 0.109 BV R aPhase is calculated according to ephemeris determined in Section 3. bObservation made at KAO cPhotometrical data are available from the first author upon request.

TABLE 2 STARS USED FOR A DETERMINATION OF ARTIFICIAL COMPARISON STARS.

System Comparison stars

Coordinates B V R

NOMAD α(2000) δ(2000) RU UMi 1596-0121876 13:38:09.84 +69:41:12.9 10.8230 10.066 9.580 1596-0122007 13:40:43.97 +69:36:34.7 9.769 9.349 9.070 1599-0114087 13:42:10.79 +69:59:01.9 10.410 9.923 9.590 VY UMi 1666-0084341 17:16:16.99 +76:37:00.25 11.725 10.338 9.470 1668-0086624 17:14:20.44 +76:52:34.29 11.313 10.602 10.130 1667-0084244 17:15:37.39 +76:42:45.44 12.036 11.589 11.290 GSC 1611-0075943 07:19:59.44 +71:08:30.09 12.288 11.841 11.540 04364-0064 1610-0077383 07:19:58.36 +71:05:32.56 11.157 10.646 10.310

3. ANALYSIS OF PERIOD CHANGES

In our analysis of period changes of all systems we have considered all available published minima times as can be found in the O − C gateway^3 as well as minima times from our (weighted averages from BV R light curves) and TESS observations.

Our new minima times were calculated following the phenomenological

3http://var2.astro.cz/ocgate/

Fig. 1. Phased light curves of RU UMi, VY UMi and GSC 04364-00648 in BV R passbands by dates of observations. The phases are calculated according to ephemerides determined in Section 3 . method described in Mikulášek (2015). This method gives a realistic and statistically significant error in determining minima times. Newly calculated minima times from our and TESS observations are listed in Tables 7-10.

Although the first minima times of RU UMi were obtained at the beginning of the previous century and cover almost the whole observed range, many of them are useless for detailed analysis. Photographic and visual estimates have a large scatter and one can expect their large internal errors. We decided to use only archived photoelectric and CCD minima times obtained since 1990 and minima times determined from our CCD and TESS light curves. Their precision is in the range of 10^{−4} days. A weighted least-squares solution using all selected minima (weights were calculated as 1/σ^2, where σ is a published or determined error of the minimum) leads to the following linear ephemeris of the RU UMi system (errors of parameters are given in parenthesis):

Min I = HJD 2452500.0931(4) + 0^d.52492591(9) × E. (1)

This ephemeris was used to create the O −C diagram displayed in Fig. 2. The inspection of O − C residua uncover their low-amplitude, wave-like variations. It can be explained by the light-time effect caused by another invisible body orbiting a common center of the mass. To find the parameters of this orbit, we used package OCFit^4 (Gajdoš & Parimucha 2019). We found that the 3^{rd} body orbiting eclipsing system with 7370 days period (≈ 20.2 years) on a slightly eccentric orbit. The resulting parameters of its orbit are listed in

4https://github.com/pavolgaj/OCFit

TABLE 3 PARAMETERS OF PERIOD CHANGES DETECTED IN THE STUDIED ECLIPSING SYSTEMS.

RU UMi VY UMi GSC 04364-00648 P [d] – 0.3254004(4) 0.862839(1) T0 – 2452500.0469(38) 2459309.7273(2) Q[d] – 1.14(3)×10^{−10} -2.67(2)×10^{−8} P3[d] 7370(42) – – T0_3 2458984(55) – – e3 0.199(1) – – ω3[^∘] 116(3) – – a12 sin i3 [AU] 0.247(2) – – f(m3) [M⊙] 3.69(8)×10^{−5} – – P , T0, Q are period, reference minimum time and quadratic term, P3, T0_3 , e3, ω3, a12 sin i3 and f(m3) describe parameters of the 3^{rd} body orbit, period, time of periastron passage, eccentricity, argument of periastron, projection of semi-major axis and function of the mass.

Tab. 3. We did not detect any secular quadratic period changes in the data used in our analysis, which contradicts the findings of Zhu et al. (2006) and Lee et al. (2008).

VY UMi has several CCD minima times published from 1999 and few visual minima times, which were omitted from our analysis. Linear ephemeris determined from a weighted least-squares solution (as in previous case) is:

Min I = HJD 24552500.0090(7) + 0^d.3254048(4) × E. (2)

Eclipsing binary GSC 04364-0064 has no published minima times. For our analysis we have used minima times determined from TESS observations and 2 our new minima times. A weighted least-squares solution using all minima (weights were calculated as in the previous cases) leads to the linear ephemeris:

Min I = HJD 24559309.7281(3) + 0^d.862851(5) × E. (3)

Ephemerides (2) and (3) were used to create the O − C diagrams of VY UMi and GSC 04364-0064 as displayed in Fig. 2. We can clearly see, that in both cases, quadratic variations are detected, which indicates mass transfer between components and/or magnetic braking. The quadratic ephemerides of both systems are given in Tab. 3.

4. LIGHT CURVE ANALYSIS

For the analysis of light curves of all three systems, we have relied on the ELISa^5 code (Čokina et al. 2021). It is a cross-platform Python software

5https://github.com/mikecokina/elisa

Fig. 2. O−C diagrams of studied systems according to linear ephemeris in Section 3.

package dedicated to modeling close eclipsing binaries including surface features such as spots and pulsations. ELISa utilizes modern approaches to the EB modeling with an emphasis on computational speed while maintaining a sufficient level of precision to process a ground-based and space-based observation. It was designed for easy use even by a not very experienced user. In this paper, we take advantage of its capability to model the light curves of close eclipsing binaries with the builtin capability to solve an inverse problem using least squares thrust region reflective algorithm and Markov Chain Monte-Carlo (MCMC) methods (for references see Čokina et al. (2021)).

At the beginning of the fitting process, it is necessary to prepare the input data. ELISa requires phased light curves with normalized flux. All our phased observations in all passbands were transformed to flux and normalized according to flux in the maxima and were simultaneously fitted by the least-square method to find the global optimal solution. Subsequently, MCMC sampling was used to produce 1σ confidence intervals of the fitted system’s parameters.

Each system was fitted with model containing 5 free parameters: orbital inclination i, photometric mass ratio q_p, surface potentials of both components Ω_1 and Ω_2 and the effective temperature of the secondary component T^{ef f}_2 . Temperature of the primary component T^{ef f}_1 for all systems were adopted from Babusiaux et al. (2022) and was fixed during fitting process, while temperatures of the secondary component were fitted with no restrictions.

For the components with convective envelopes (effective temperatures bellow ∼7000 K), the albedos A_1, A_2 of components were set to 0.6 (Ruciński 1969) and gravity darkening factors, g_1 and g_2 to 0.32 (Lucy 1967). In the case of radiative envelope (above ∼7000 K), the values of albedo and gravity

TABLE 4

PHOTOMETRIC PARAMETERS OF THE STUDIED SYSTEMS

RU UMi VY UMi GSC 04364-00648 Primary Secondary Primary Secondary Primary Secondary i [deg] 83.4^{+0.15}_{−0.22} 85.1^{+0.22}_{−0.25} 76.9^{+0.20}_{−0.21} qp (M2/M1) 0.341^{+0.010}_{−0.006} 0.536^{+0.023}_{−0.025} 0.440^{+0.014}_{−0.015} T [K] 7420^a 4885^{+148}_{−201} 5340^a 4850^{+240}_{−250} 7970^a 4065^{+44}_{−49} Ω 2.632^{+0.013}_{−0.007} 2.568^{+0.037}_{−0.019} 2.821^{+0.034}_{−0.036} 4.138^{+0.033}_{−0.033} 2.767^{+0.032}_{−0.030} l^V /l^V_{tot} 0.93^{+0.02}_{−0.03} 0.07^{+0.09}_{−0.10} 0.68^{+0.09}_{−0.10} 0.32^{+0.06}_{−0.07} 0.92^{+0.05}_{−0.06} 0.08^{+0.03}_{−0.03} Ωcrit 2.553^{+0.022}_{−0.012} 2.943^{+0.032}_{−0.00.035} 2.760^{+0.029}_{−0.028} R^{eq} [SMA] 0.457^{+0.001}_{−0.002} 0.286^{+0.001}_{−0.001} 0.465^{+0.002}_{−0.001} 0.357^{+0.001}_{−0.001} 0.273^{+0.002}_{−0.001} 0.308^{+0.002}_{−0.002} a - Temperature of the primary component for all systems were adopted from Babusiaux et al. (2022)

darkening factor were both set to 1.0. Castelli & Kurucz (2003) models of stellar atmospheres were used. The linear limb darkening coefficients for each component were interpolated from the van Hamme (1993) tables.

The weights of individual data points were established as 1/σ^2, where σ is the standard error of point derived during photometric measurement. Initially, the least-square algorithm was used with suitable initial parameters to find an approximate solution and then the parameter space near the solution was explored with MCMC sampler with 500 walkers and 500 iterations with prior 300 iterations discarded as it belonged to the thermalization stage of the sampling.

The resulting as well as derived parameters of all systems, like relative luminosities of the components in V filter l^V_{1,2}/l^V_{tot}, a critical potential Ω_{crit}, corresponding equivalent radius R^{eq} in SMA units (semi-major axis) are listed in Tab. 4. The best-fit models with observed LCs and resulting flat chains displayed in the form of the corner plot are shown in Fig. 3 and 3D models with the surface temperature distributions are shown in Fig. 4.

5. ABSOLUTE PARAMETERS OF THE SYSTEMS

The absolute parameters of the binary components, like their masses M_{1,2}, radii R_{1,2}, luminosities L_{1,2} and semi-major axis of the orbit a, can be mainly determined by the combination of photometric solution and analysis of radial velocity curve. Radial velocities are available only for RU UMi system (Okazaki et al. 1988; Maxted & Hilditch 1996). We used their measurements and re-analyze them with ELISa code (assuming circular orbit) and determined orbital and absolute parameters of the components as listed in Tab.5.

But if we know the distance to object from independent measurement (e.g parallaxes from GAIA measurements), we can find absolute parameters from properties of binary derived from photometric solution and using basic relationships, described in the following text.

TABLE 5 PARAMETERS OF THE SPECTROSCOPIC ORBIT AND ABSOLUTE PARAMETERS OF RU UMI SYSTEM DERIVED FROM RADIAL VELOCITY AND LIGHT CURVE SOLUTIONS.

M1 [M⊙] 2.65^{+0.11}_{−0.16} K1 [km/s] 96.5^{+6.4}_{−5.9} M2 [M⊙] 0.85^{+0.12}_{−0.10} K1 [km/s] 301.6^{+10.8}_{−8.3} R1 [R⊙] 1.89^{+0.7}_{−0.4} q 0.32^{+0.02}_{−0.02} R2 [R⊙] 1.18^{+0.4}_{−0.3} a sin i [R⊙] 4.13^{+0.11}_{−0.08} L1 [L⊙] 9.61^{+2.51}_{−1.48} γ [km/s] −21.0^{+3.8}_{−4.0} L2 [L⊙] 0.71^{+0.16}_{−0.12} a [R⊙] 4.15^{+0.12}_{−0.09}

Let us assume that we have calculated q_p, i, T_{1,2}, R^{eq}_{1,2} and l^V_{1,2}/l^V_{tot} from analysis of the light curves and we know standard V magnitude of system in phase 0.25. Absolute magnitude M_V of the system we can find from equation

M^V = V − 5 log(d) + 5 − A^V , (4)

where d is distance and extinction coefficient A^V can be determined from the dust map in Green et al. (2019). The absolute magnitudes of each component can be find from relation

M^V_{1,2} − M^V = −2.5 log l^V_{1,2} l^V_{tot} . (5)

Corresponding bolometric magnitude is

M^{Bol}_{1,2} = M^V_{1,2} + BC, (6)

where bolometric corection is from Eker et al. (2020). If we assume that bolometric magnitude of the Sun is M^{Bol}_⊙ =4.73 mag (Torres 2010), the luminosities of components can be found from

M^{Bol}_{1,2} − M^{Bol}_⊙ = −2.5 log L_{1,2} L_⊙ , (7)

and corresponding radii R_{1,2} = √ L_{1,2} 4πσT^4_{1,2}

. (8)

The distance between components can be found using their equivalent radii R^{eq}_{1,2} a = 1 2 ( R_1 R^{eq}_1 + R_2 R^{eq}_2 ) . (9)

Total mass M_1 + M_2 of the system we can derive using Kepler’s 3^{rd} law a^3 P^2 = G(M_1 + M_2) 4π^2

, (10)

TABLE 6

ABSOLUTE PARAMETERS OF THE STUDIED SYSTEMS DERIVED FROM THEIR DISTANCES AND PHOTOMETRIC SOLUTIONS.

RU UMi VY UMi GSC 04364-00648 Primary Secondary Primary Secondary Primary Secondary M [M⊙] 1.90(21) 0.64(17) 0.97(15) 0.52(18) 2.54(42) 1.12(31) R [R⊙] 1.55(11) 1.16(9) 0.96(2) 0.87(2) 1.22(3) 2.25(5) L [L⊙] 6.61(1.47) 0.69(14) 0.67(10) 0.38(11) 5.40(1.34) 1.24(23) a [R⊙] 3.74(37) 2.27(21) 5.88(79) A^V [mag] 0.0 0.0 0.03(3) M^{Bol} [mag] 2.67(7) 5.12(13) 5.16(8) 5.75(14) 2.89(8) 4.49(11) BC [mag] 0.06 -0.31 -0.082 -0.30 0.03 -1.03 d [pc] 283.0(1.2) 164.5(3) 512.5(4.8)

and individual masses can be found from mass ratio q_p.

The absolute parameters for the studied objects determined by the method described above are listed in Tab. 6. The uncertainties of the parameters were calculated considering the errors of the light curve solutions of the systems and errors in their distances.

6. DISCUSSION AND CONCLUSIONS

In our study, we have presented the photometric analysis of multi-color BV R and TESS photometry of three eclipsing binaries, RU UMi, VY UMi and GSC 04364-00648, for the first time for the last two systems. We have also analyzed their period variations considering archival data and our new minima times. The presented photometry solutions, mainly for VY UMi and GSC 04364-00648, has some small disagreements with observations, the residuals at some phases show up to 0.1 deviations in normalized flux value. These issues can be caused by spots, weather conditions, etc. They are really small, and we can not even try to explain what phenomena they are caused by. Future observation is needed for this purpose.

RU UMi has been studied in the past years by several authors. Recently, Lee et al. (2008) analyzed period variation, fitted light-curve and determined absolute parameters of the components from radial velocities solution. From their period analysis authors concluded that long-term period changes can be caused by the combination of angular momentum loss (AML) and mass transfer from the less massive secondary to the more massive primary. In our period analysis, we used only minima times obtained from ground-based photoelectric and CCD observations as well as satellite observations from TESS, where we can expect higher precision with respect to older visual and photographic observations. We detected wave-like variations with low-amplitude (∼ 5 minutes) in O − C residua. It can be interpreted as a consequence of the light-time effect caused by the 3^{rd} invisible component. From the parameters listed in Tab. 3 we can see that the orbital period of the 3^{rd} body is 7370 days and the orbit is slightly eccentric. According to the mass function of the 3^{rd} body f(m_3) and masses of the binary components (see Tab. 6), we can find that the minimum mass of the 3^{rd} component in the case of the edge-on orbit (sin i_3 = 1) should be M_3=0.063(16)M_⊙ ∼ 60M_J . It corresponds to a low massive red dwarf or more probably (due to its mass) it is a brown dwarf (Joergens 2014) with very low luminosity. It is supported also by the results of the photometric solution, where no 3^{rd} light was detected. Photometric analysis of BV R and TESS light curves confirmed previous findings that RU UMi is a near contact system with a secondary component that almost fulfills its Roche lobe. We were not able to find any satisfactory LC solution with spot(s) (not evenTESS LC) as was done by Lee et al. (2008), although some wave-like variation is visible in residuals in Fig. 3. We can explain it by the temporal evolution of the spot, when spot’s parameters such as diameter, temperature and position on the star’s surface are changing during decades. Our absolute parameters of components determined from radial velocity solution are little bigger than presented in Lee et al. (2008). On the other side, absolute parameters determined from GAIA parallax are smaller than previously determined and correspond to A6V primary component and evolved K5 star secondary. This differences deserves deeper analysis, because many factors can affect results. One of them is a mass ratio which has strong influence to partial dimensions of the components as well as inclination due to q − i correlation. Terrell & Wilson (2005) showed that the photometric mass ratio for semi-detached and over-contact binaries is often overestimated for partial eclipses. Recently Terrell (2022) noted that not properly modeled third light will lead to mass ratios that are too low. Our solution of RU UMi show no third light and no total eclipses on the LCs (just like other stars). Presented photometric mass ratios q_p have to be considered as a high estimates and this affects also determination of absolute parameters from distances.

Photometric analysis of VY UMi showed that the system is a typical W UMa type overcontact binary with a more massive primary component (q_p = 0.535). Its orbital period and determined temperatures of both components place the system in a W-type subclass of overcontact binaries. The detected parabolic period change reflected on the O − C diagram can be explained by the mass transfer from a less massive star to a more massive one. Period increase with rate 2.56(9)×10^{−7} d/yr^{−1} detected in the VY UMi system corresponds to mass transfer from the secondary to the primary component.

The first photometric solution of GSC 04364-00648 light curves revealed that the system is semi-detached binary, where a cool secondary component almost fills its Roche lobe as detected in some other near-contact systems, like EG Cep (Djurašević et al. 2013) or CR Tau (Kudak et al. 2021). Although we can see some quadratic changes on the O − C diagram, which corresponds to a period decrease with a high rate of −2.26(5) × 10^{−5} d/yr^{−1}, we cannot make strict conclusions about period variation in the system, mainly due to

12 KUDAK ET AL.

short time (2019-2021) and uneven coverage of O − C diagram. We have to wait for other observations to confirm or disprove this trend.

Acknowledgments

This work was supported by Ukrainian national grant 0122U000937 and by the Slovak Research and Development Agency under contract No. APVV-20- 0148. The research of P.G. was supported by the internal grant No. VVGS- PF-2021-2087 of the Faculty of Science, P. J. Šafárik University in Košice.

REFERENCES

Applegate, J. H. 1992, ApJ, 385, 621 Babusiaux, C., Fabricius, C., Khanna, S., Muraveva, T., Reylé, C., Spoto, F., Vallenari, A., Luri, X., Arenou, F., Alvarez, M. A., Anders, F., Antoja, T., Balbinot, E., Barache, C., Bauchet, N., Bossini, D., Busonero, D., Cantat-Gaudin, T., Carrasco, J. M., Dafonte, C., Diakite, S., Figueras, F., Garcia-Gutierrez, A., Garofalo, A., Helmi, A., Jimenez-Arranz, O., Jordi, C., Kervella, P., Kostrzewa- Rutkowska, Z., Leclerc, N., Licata, E., Manteiga, M., Masip, A., Monguio, M., Ramos, P., Robichon, N., Robin, A. C., Romero-Gomez, M., Saez, A., Santovena, R., Spina, L., Torralba Elipe, G., & Weiler, M. 2022, arXiv e-prints, arXiv:2206.05989 Bell, S. A., Hilditch, R. W., & Edwin, R. P. 1993, MNRAS, 260, 478 Castelli, F. & Kurucz, R. L. 2003, in Modelling of Stellar Atmospheres, Vol. 210, A20 Chen, X., Wang, S., Deng, L., de Grijs, R., & Yang, M. 2018, ApJS, 237, 28 de Bernardi, C. & Scaltriti, F. 1977, Acta Astron., 27, 187 Djurašević, G., Bas_, türk, Ö., Latković, O., Yılmaz, M., Çalıs_, kan, Ş., Tanrıverdi, T., Şenavcı, H. V., Kılıçoǧlu, T., & Ekmekçi, F. 2013, AJ, 145, 80 Eker, Z., Soydugan, F., Bilir, S., Bakış, V., Aliçavuş, F., Özer, S., Aslan, G., Alpsoy, M., & Köse, Y. 2020, MNRAS, 496, 3887 Gajdoš, P. & Parimucha, Š. 2019, Open European Journal on Variable Stars, 197, 71 Green, G. M., Schlafly, E., Zucker, C., Speagle, J. S., & Finkbeiner, D. 2019, ApJ, 887, 93 Hilditch, R. W. 2001, An Introduction to Close Binary Stars (Cambridge University Press) Ivezić, Ž., Kahn, S. M., Tyson, J. A., Abel, B., Acosta, E., Allsman, R., Alonso, D., AlSayyad, Y., Anderson, S. F., Andrew, J., & et al. 2019, ApJ, 873, 111 Joergens, V., ed. 2014, Astrophysics and Space Science Library, Vol. 401, 50 Years of Brown Dwarfs: From Prediction to Discovery to Forefront of Research Kaluzny, J. 1985, Acta Astron., 35, 327 Kudak, V., Fedurco, M., Perig, V., & Parimucha, Š. 2021, Research in Astronomy and Astrophysics, 21, 174 Lee, J. W., Kim, C.-H., Kim, S.-L., Lee, C.-U., Han, W., & Koch, R. H. 2008, PASP, 120, 720 Lucy, L. B. 1967, ZAp, 65, 89 Maxted, P. F. L. & Hilditch, R. W. 1996, The Observatory, 116, 288 Mikulášek, Z. 2015, A&A, 584, A8

ANALYSIS OF 3 NEGLECTED BINARIES 13

Nha, I. S. 1973, AJ, 78, 107 Okazaki, A., Nakamura, Y., & Yamasaki, A. 1988, PASJ, 40, 79 Otero, S. A. & Dubovsky, P. A. 2004, Information Bulletin on Variable Stars, 5557, 1 Parimucha, Š., Savanevych, V. E., Briukhovetskyi, O. B., Khlamov, S. V., Pohorelov, A. V., Vlasenko, V. P., Dubovský, P. A., & Kudzej, I. 2019, Contributions of the Astronomical Observatory Skalnate Pleso, 49, 151 Prša, A. 2019, Modeling and Analysis of Eclipsing Binary Stars : The theory and design principles of PHOEBE (Institute of Physics Publishing) Ricker, G. R. 2014, JAAVSO, 42, 234 Ruciński, S. M. 1969, Acta Astron., 19, 245 Savanevych, V. E., Briukhovetskyi, O. B., Khlamov, S. V., Pohorelov, A. V., Vlasenko, V. P., Dubovsky, P. A., Kudzej, I., & Parimucha, S. 2017, Odessa Astronomical Publications, 30, 194 Strohmeier, W. 1958, KVB, 23 Strohmeier, W. & Bauernfeind, H. 1968, Bamberg Veroeffentlichungen der Remeis- Sternwarte, 7, 72 Terrell, D. 2022, Galaxies, 10, 8 Terrell, D. & Wilson, R. E. 2005, Ap&SS, 296, 221 Torres, G. 2010, AJ, 140, 1158 van Hamme, W. 1993, AJ, 106, 2096 Čokina, M., Fedurco, M., & Parimucha, Š. 2021, A&A, 652, A156 Watson, C. L., Henden, A. A., & Price, A. 2006, Society for Astronomical Sciences Annual Symposium, 25, 47 Wood, D. B. 1971, PASP, 83, 286 Yang, Y. G., Lü, G. L., Yin, X. G., Zhu, C. H., & Nakajima, K. 2009, AJ, 137, 236 Zacharias, N., Monet, D. G., Levine, S. E., Urban, S. E., Gaume, R., & Wycoff, G. L.

2004, in American Astronomical Society Meeting Abstracts, Vol. 205, American Astronomical Society Meeting Abstracts, 48.15 Zacharias, N., Monet, D. G., Levine, S. E., Urban, S. E., Gaume, R., & Wycoff, G. L. 2005, VizieR Online Data Catalog, I/297 Zhu, L.-Y., Qian, S.-B., & Xiang, F.-Y. 2006, PASJ, 58, 361

V.Kudak and V.Perig: Laboratory of space researches, Uzhhorod National University, Uzhhorod, Daleka Str., 2A, 88000, Ukraine (labspace@uzhnu.edu.ua) M.Fedurco, P. Gajdoš and Š.Parimucha: Institute of Physics, Faculty of Science, P.J. Šafárik University, Košice, Park Angelinum 9, 04001, Slovakia (stefan.parimucha@upjs.sk)

14 KUDAK ET AL.

Fig. 3. The synthetic model fitted on observational data of (from top) RU UMi, VY UMi and GSC 04364-0064 together with the corresponding results of the MCMC sampling displayed in the form of the corner plot.

ANALYSIS OF 3 NEGLECTED BINARIES 15

Fig. 4. 3D models with the surface temperature distributions of (from top) RU UMi, VY UMi and GSC 04364-0064

16 KUDAK ET AL.

APPENDICES

TABLE 7: RU UMi times of minima determined from TESS lightcurves. Errors are in parenthesis.

BJD BJD BJD BJD BJD BJD BJD 58683.4591(5) 58706.2924(2) 58730.7012(1) 58886.8666(2) 58910.7460(11) 59428.8517(1) 59585.0166(2) 58683.7210(10) 58706.5541(1) 58730.9632(2) 58887.1296(1) 58911.0137(7) 59429.1138(2) 59585.5416(2) 58683.9827(1) 58706.8163(2) 58731.2262(9) 58887.3914(2) 58911.2710(10) 59429.3768(1) 59585.8049(2) 58684.2447(2) 58707.0794(1) 58731.4882(2) 58887.6544(1) 58911.5387(7) 59429.6388(2) 59586.0665(2) 58684.5074(1) 58707.3413(2) 58731.7511(1) 58887.9164(2) 58911.7950(20) 59429.9018(1) 59586.3312(2) 58684.7694(2) 58707.6043(1) 58732.0130(21) 58888.1793(1) 58913.9016(3) 59430.1637(2) 59586.5911(2) 58685.0323(1) 58707.8672(2) 58732.2761(1) 58888.4413(2) 58914.1627(2) 59430.4267(1) 59586.8546(2) 58685.2944(2) 58708.1292(1) 58732.5380(20) 58888.7046(1) 58914.4261(2) 59430.6886(2) 59587.1164(2) 58685.5573(1) 58708.3912(2) 58732.8008(1) 58888.9664(2) 58914.6877(2) 59430.9515(1) 59587.3796(2) 58685.8194(2) 58708.6541(1) 58733.0630(21) 58889.2293(1) 58914.9513(3) 59431.2135(2) 59587.6413(2) 58686.0823(1) 58708.9161(2) 58733.3253(2) 58889.4912(2) 58915.2128(2) 59431.4764(1) 59587.9044(2) 58686.3443(2) 58709.1791(1) 58733.5904(2) 58889.7543(1) 58915.4765(3) 59431.7385(2) 59588.1662(2) 58686.6071(1) 58709.4411(2) 58733.8509(1) 58890.0161(2) 58915.7377(1) 59432.0014(1) 59588.4297(2) 58686.8692(2) 58709.7040(1) 58734.1127(2) 58890.2793(1) 58916.0014(3) 59432.2631(1) 59588.6911(2) 58687.1321(1) 58709.9671(2) 58734.3757(1) 58890.5410(21) 58916.2626(1) 59432.5255(6) 59588.9543(2) 58687.3941(2) 58711.8037(1) 58734.6377(2) 58890.8042(1) 58916.5259(4) 59433.8383(2) 59589.2161(2) 58687.6569(1) 58712.0657(2) 58734.9006(1) 58891.0661(2) 58916.7789(8) 59434.1010(10) 59589.4791(2) 58688.1820(12) 58712.3286(1) 58735.1626(2) 58891.3293(1) 58917.0450(9) 59434.3631(2) 59589.7410(20) 58688.4440(23) 58712.5906(2) 58735.4257(1) 58891.5913(1) 58917.3119(7) 59434.6260(10) 59590.0042(2) 58688.7068(1) 58712.8536(1) 58735.6874(2) 58891.8539(1) 58917.5720(11) 59434.8880(21) 59590.2660(20) 58688.9690(21) 58713.1156(2) 58735.9504(1) 58892.1159(2) 58917.8376(6) 59435.1510(9) 59590.5291(2) 58689.2316(1) 58713.3785(1) 58736.2125(2) 58892.3788(1) 58918.0950(21) 59435.4130(22) 59590.7908(2) 58689.4937(2) 58713.6405(2) 58736.4755(1) 58892.6407(2) 58918.3627(7) 59435.6760(10) 59591.0541(2) 58689.7567(1) 58713.9036(1) 58736.7374(2) 58892.9037(1) 58918.8876(7) 59435.9379(2) 59591.3158(2) 58690.0188(2) 58714.1654(2) 58737.0004(1) 58893.1657(2) 58919.1440(20) 59436.2008(1) 59591.5790(20) 58690.2813(1) 58714.4286(1) 58870.8572(3) 58893.4289(1) 58919.4125(7) 59436.4628(2) 59591.8407(2) 58690.5437(2) 58714.6905(2) 58871.1191(2) 58893.6906(2) 58920.2051(9) 59436.7257(1) 59592.1039(2) 58690.8065(1) 58714.9533(1) 58871.3818(1) 58893.9536(1) 58920.7190(20) 59436.9877(2) 59592.3656(2) 58691.0687(2) 58715.2165(2) 58871.6437(2) 58894.2156(2) 58920.9868(7) 59437.2507(1) 59592.6290(20) 58691.3313(1) 58715.4772(3) 58871.9065(1) 58894.4786(1) 58921.2450(21) 59437.5127(2) 59594.2037(2) 58691.5935(2) 58716.0030(10) 58872.1686(2) 58894.7404(2) 58921.5123(7) 59437.7756(1) 59594.4653(2) 58691.8563(1) 58716.2651(2) 58872.4315(1) 58895.0033(1) 58921.7690(20) 59438.0377(2) 59594.7287(2) 58692.1184(2) 58716.5281(1) 58872.6935(2) 58895.2654(2) 58922.0371(7) 59438.3006(1) 59594.9902(2) 58692.3850(20) 58716.7901(2) 58872.9569(2) 58895.5285(1) 58922.2950(21) 59438.5625(2) 59595.2537(2) 58692.6441(2) 58717.0529(1) 58873.2186(2) 58895.7904(2) 58922.5621(7) 59438.8254(1) 59595.5152(2) 58692.9063(1) 58717.3150(24) 58873.4816(1) 58896.0534(1) 58922.8190(20) 59439.0874(2) 59595.7789(2) 58693.1684(2) 58717.5779(1) 58873.7435(2) 58896.3154(1) 58923.0864(7) 59439.3504(1) 59596.0401(2) 58693.4313(1) 58717.8400(21) 58874.0064(1) 58896.5783(1) 58923.3430(22) 59439.6124(2) 59596.3035(2) 58693.6934(2) 58718.1031(1) 58874.2683(2) 58896.8402(2) 58923.8690(20) 59439.8754(1) 59596.5651(2) 58693.9559(1) 58718.3648(2) 58874.5313(1) 58897.1032(1) 58924.1364(7) 59440.1374(2) 59596.8285(1) 58694.2182(2) 58718.6278(1) 58874.7932(2) 58897.3653(2) 58924.3940(21) 59440.4003(1) 59597.0899(2) 58694.4807(1) 58718.8898(2) 58875.0564(1) 58897.6277(1) 58924.6619(7) 59440.6622(2) 59597.3534(2) 58694.7431(2) 58719.1527(1) 58875.3182(2) 58899.4663(1) 58924.9190(20) 59440.9250(10) 59597.6149(2) 58695.0062(1) 58719.4159(2) 58875.5813(1) 58899.7285(3) 58925.1867(7) 59441.1872(2) 59597.8782(2) 58695.2681(2) 58719.6771(2) 58875.8430(20) 58899.9897(2) 58925.4440(21) 59441.7120(20) 59598.1398(2) 58695.5308(1) 58719.9590(20) 58876.1061(1) 58900.2535(3) 58925.9690(20) 59441.9750(10) 59598.4031(2) 58695.7930(22) 58720.2025(1) 58876.3679(1) 58900.5156(2) 58926.2364(8) 59442.2370(20) 59598.6647(2) 58696.0559(1) 58720.4646(2) 58876.6317(6) 58900.7786(3) 58926.4860(10) 59442.7619(2) 59598.9282(2) 58697.6307(1) 58720.7277(1) 58876.8921(3) 58901.0399(1) 59420.1901(2) 59443.0250(10) 59599.1897(2) 58697.8928(2) 58720.9896(2) 58877.1560(12) 58901.3032(3) 59420.4530(10) 59443.2868(2) 59599.4528(2) 58698.1556(9) 58721.2525(1) 58877.4178(2) 58901.5648(1) 59420.7150(20) 59443.5498(1) 59599.7146(2) 58698.4177(2) 58721.5145(2) 58877.6809(1) 58901.8268(4) 59420.9779(9) 59443.8117(2) 59599.9780(20) 58698.6805(1) 58721.7773(1) 58877.9427(2) 58902.0899(1) 59421.2399(2) 59444.0746(1) 59600.2408(3) 58698.9425(2) 58722.0394(2) 58878.2058(1) 58902.3519(3) 59421.5030(10) 59444.3367(2) 59600.7660(10) 58699.2056(1) 58722.3024(1) 58878.4677(2) 58902.6069(6) 59421.7650(20) 59444.5996(1) 59601.0278(2) 58699.4674(2) 58722.5642(2) 58878.7308(1) 58902.8732(8) 59422.0278(1) 59444.8616(2) 59601.2894(2) 58699.7303(1) 58722.8273(1) 58878.9927(2) 58903.1397(6) 59422.2898(2) 59445.1246(1) 59601.5529(2) 58699.9923(2) 58723.0893(2) 58879.2555(1) 58903.4005(9) 59422.5527(1) 59445.3865(2) 59601.8143(2) 58700.2553(1) 58723.3520(12) 58879.5176(2) 58903.6752(8) 59422.8147(2) 59445.6495(1) 59602.0777(2) 58700.5173(2) 58723.6155(2) 58879.7806(1) 58903.9267(4) 59423.0777(1) 59445.9114(2) 59602.3393(2) 58700.7803(1) 58725.1890(23) 58880.0425(2) 58904.1896(1) 59423.3397(2) 59446.1744(1) 59602.6026(2) 58701.0422(2) 58725.4521(1) 58880.3056(1) 58904.4516(4) 59423.6027(1) 59446.4364(2) 59602.8642(2) 58701.3053(1) 58725.7154(2) 58880.5674(2) 58904.7147(1) 59423.8646(2) 59580.0305(1) 59603.1274(2) 58701.5570(11) 58725.9739(9) 58880.8305(1) 58904.9773(3) 59424.1275(1) 59580.2920(20) 59603.3891(2) 58701.8292(3) 58726.2402(1) 58881.0923(2) 58905.2393(1) 59424.3894(2) 59580.5558(2) 59603.6525(2) 58702.0927(2) 58726.5019(1) 58881.3554(1) 58905.5015(4) 59424.6525(1) 59580.8172(2) 59603.9141(2) 58702.3552(1) 58726.7639(2) 58881.6173(2) 58906.0240(9) 59424.9144(2) 59581.0806(2) 59604.1773(2) 58702.6170(20) 58727.0268(1) 58881.8804(1) 58906.5460(22) 59425.1773(1) 59581.3422(2) 59604.4390(20) 58702.8797(1) 58727.2888(2) 58882.1422(2) 58906.8143(7) 59425.4394(2) 59581.6057(2) 59604.7026(1) 58703.1419(2) 58727.5517(1) 58882.4053(1) 58907.0720(11) 59425.7022(1) 59581.8670(20) 59604.9638(2) 58703.4050(1) 58727.8136(2) 58882.6668(1) 58907.3392(6) 59425.9640(10) 59582.1305(2) 59605.2275(2) Continued on next page

ANALYSIS OF 3 NEGLECTED BINARIES 17

Table 7 – continued from previous page BJD BJD BJD BJD BJD BJD BJD 58703.6669(2) 58728.0766(1) 58882.9380(10) 58907.5960(22) 59426.2276(7) 59582.3920(20) 59605.4888(2) 58703.9298(1) 58728.3386(2) 58883.1923(2) 58907.8639(6) 59426.4890(20) 59582.6552(2) 59605.7526(2) 58704.1918(2) 58728.6015(1) 58883.4553(1) 58908.1210(19) 59426.7521(1) 59582.9169(2) 59606.0138(2) 58704.4548(1) 58728.8633(2) 58883.7169(1) 58908.3891(6) 59427.0141(2) 59583.1802(2) 59606.2774(2) 58704.7168(2) 58729.1258(4) 58885.2924(1) 58908.6470(10) 59427.2771(1) 59583.4419(2) 59606.5387(2) 58704.9797(1) 58729.3882(3) 58885.5549(1) 58909.1720(11) 59427.5390(19) 59583.7054(2) 58705.2418(2) 58729.6514(1) 58885.8167(2) 58909.6960(22) 59427.8019(1) 59583.9668(2) 58705.5044(1) 58729.9134(2) 58886.0798(1) 58909.9638(6) 59428.0640(20) 59584.2301(2) 58705.7660(1) 58730.1763(1) 58886.3415(2) 58910.2220(10) 59428.3270(10) 59584.4918(2) 58706.0289(2) 58730.4383(2) 58886.6049(1) 58910.4888(7) 59428.5889(2) 59584.7552(2)

TABLE 8: VY UMi times of minima determined from TESS lightcurves. Errors are in parenthesis.

BJD BJD BJD BJD BJD BJD BJD 59390.7777(4) 59406.5601(1) 59423.1556(1) 59439.1004(1) 59586.9968(2) 59602.7798(1) 59619.5379(2) 59390.9408(1) 59406.7234(1) 59423.3189(1) 59439.2638(1) 59587.1606(1) 59602.9422(1) 59619.7013(1) 59391.1038(1) 59406.8855(1) 59423.4809(1) 59439.4256(1) 59587.3229(2) 59603.1054(1) 59619.8635(2) 59391.2662(9) 59407.0486(1) 59423.6442(1) 59439.5892(1) 59587.4858(1) 59603.2671(1) 59620.0265(1) 59391.4289(2) 59407.2108(1) 59423.8064(1) 59439.7511(1) 59587.6475(2) 59603.4307(1) 59620.1888(2) 59391.5915(1) 59407.3742(6) 59423.9697(1) 59439.9134(6) 59587.8113(1) 59603.5931(2) 59620.3517(1) 59391.7547(1) 59407.5363(1) 59424.1318(1) 59440.0763(3) 59587.9738(2) 59603.7562(1) 59620.5133(2) 59391.9169(1) 59407.6994(1) 59424.2951(1) 59440.2385(5) 59588.1367(1) 59603.9184(1) 59620.6776(1) 59392.0801(1) 59407.8616(1) 59424.4572(1) 59440.4021(1) 59588.2990(20) 59604.0816(1) 59620.8388(2) 59392.2424(1) 59408.0249(1) 59424.6205(1) 59440.5653(1) 59588.4624(1) 59604.2432(2) 59621.0027(1) 59392.4057(1) 59408.1872(1) 59424.7823(1) 59440.7273(1) 59588.6246(2) 59604.4070(10) 59621.1641(2) 59392.5679(1) 59408.3502(1) 59424.9458(1) 59440.8908(4) 59588.7877(1) 59604.5693(2) 59621.3282(1) 59392.7308(1) 59408.5126(1) 59425.1076(1) 59441.0528(1) 59588.9499(2) 59604.7324(1) 59623.7672(3) 59392.8932(1) 59408.6759(1) 59425.2713(1) 59441.2162(1) 59589.1131(1) 59604.8948(2) 59623.9314(1) 59393.0563(1) 59408.8379(1) 59425.4330(1) 59441.3783(8) 59589.2746(2) 59605.0579(1) 59624.0937(2) 59393.2186(1) 59409.0012(1) 59425.5967(1) 59441.5415(1) 59589.4384(1) 59605.2201(2) 59624.2567(1) 59393.3817(1) 59409.1633(7) 59425.7585(1) 59441.7035(1) 59589.6001(2) 59605.3833(1) 59624.4181(2) 59393.5440(1) 59409.3265(5) 59425.9221(1) 59441.8670(1) 59589.7640(10) 59605.5454(1) 59624.5821(1) 59393.7071(1) 59409.4887(1) 59426.0814(7) 59442.0290(1) 59589.9254(2) 59605.7087(1) 59624.7435(2) 59393.8695(1) 59409.8141(8) 59426.2465(6) 59442.1924(1) 59590.0894(1) 59605.8704(1) 59624.9080(10) 59394.0326(1) 59409.9773(1) 59426.4062(7) 59442.3543(9) 59590.2510(20) 59606.0341(1) 59625.0699(2) 59394.1949(1) 59410.1395(1) 59426.5724(2) 59442.5177(1) 59590.4148(1) 59606.1958(1) 59625.2333(1) 59394.3579(6) 59410.3029(1) 59426.7349(1) 59442.6798(1) 59590.5763(2) 59606.3593(1) 59625.3954(2) 59394.5203(1) 59410.4649(1) 59426.8984(1) 59442.8432(1) 59590.7402(1) 59606.5210(21) 59625.5582(1) 59394.6834(1) 59410.6282(1) 59427.0602(1) 59443.0053(8) 59590.9025(2) 59606.6845(1) 59625.7198(2) 59394.8458(1) 59410.7903(1) 59427.2239(2) 59443.1686(1) 59591.0655(1) 59606.8457(6) 59625.8842(1) 59395.0089(1) 59410.9536(1) 59427.3855(8) 59443.3307(1) 59591.2270(22) 59608.7994(5) 59626.0452(2) 59395.1711(1) 59411.1158(8) 59427.5491(1) 59443.4936(2) 59591.3909(1) 59608.9619(6) 59626.2091(1) 59395.3340(1) 59411.2790(1) 59427.7110(1) 59443.6561(1) 59591.5524(2) 59609.1250(20) 59626.3716(2) 59395.4964(1) 59411.4411(1) 59427.8745(1) 59443.8194(1) 59591.7167(1) 59609.2881(1) 59626.5349(1) 59395.6595(1) 59411.6045(1) 59428.0365(1) 59443.9814(1) 59591.8786(2) 59609.4504(2) 59626.6960(20) 59395.8218(1) 59411.7662(1) 59428.1999(1) 59444.1450(20) 59592.0418(1) 59609.6136(1) 59626.8599(1) 59395.9849(7) 59411.9293(5) 59428.3618(1) 59444.3068(1) 59592.2041(2) 59609.7759(2) 59627.0214(2) 59396.1472(1) 59412.2538(5) 59428.5254(4) 59444.4702(1) 59592.3671(1) 59609.9389(1) 59627.1854(1) 59396.3105(6) 59412.4174(1) 59428.6871(1) 59444.6322(1) 59592.5294(2) 59610.1014(2) 59627.3469(2) 59396.4726(1) 59412.5807(1) 59428.8502(2) 59444.7956(4) 59592.6923(1) 59610.2643(1) 59627.5107(1) 59396.6359(1) 59412.7423(1) 59429.0128(1) 59444.9575(1) 59592.8531(7) 59610.4258(2) 59627.6733(2) 59396.7979(1) 59412.9060(1) 59429.1762(1) 59445.1211(1) 59594.1564(2) 59610.5896(10) 59627.8365(1) 59396.9612(1) 59413.0683(1) 59429.3381(1) 59445.2829(1) 59594.3195(1) 59610.7512(2) 59627.9986(3) 59397.1235(1) 59413.2315(1) 59429.5013(1) 59445.4465(1) 59594.4818(2) 59610.9151(1) 59628.1617(1) 59397.2868(8) 59413.3933(1) 59429.6636(1) 59445.6085(1) 59594.6448(1) 59611.0776(2) 59628.3240(20) 59397.4484(8) 59413.5568(1) 59429.8271(1) 59445.7719(1) 59594.8071(2) 59611.2406(1) 59628.4874(1) 59397.6121(5) 59413.7187(1) 59429.9891(1) 59445.9338(1) 59594.9701(1) 59611.4029(2) 59628.6495(2) 59397.7769(8) 59413.8823(1) 59430.1524(1) 59446.0972(1) 59595.1324(1) 59611.5659(1) 59628.8123(1) 59397.9374(1) 59414.0444(1) 59430.3143(1) 59446.2594(1) 59595.2957(1) 59611.7274(2) 59628.9748(3) 59398.0996(1) 59414.2076(1) 59430.4778(6) 59446.4218(3) 59595.4574(1) 59611.8914(1) 59629.1382(1) 59398.2627(1) 59414.3698(1) 59430.6397(1) 59579.8384(5) 59595.6210(1) 59612.0537(2) 59629.3015(7) 59398.4249(1) 59414.5330(1) 59430.8032(1) 59580.0012(5) 59595.7833(2) 59612.2168(1) 59629.6234(8) 59398.5883(1) 59414.6951(1) 59430.9652(1) 59580.1634(2) 59595.9464(1) 59612.3791(2) 59629.7886(1) 59398.7504(1) 59414.8587(2) 59431.1286(1) 59580.3274(1) 59596.1089(2) 59612.5422(1) 59630.1141(1) 59398.9137(1) 59415.0204(1) 59431.2905(1) 59580.4896(2) 59596.2717(1) 59612.7036(2) 59630.2754(2) 59399.0757(1) 59415.1837(1) 59431.4540(1) 59580.6528(1) 59596.4342(1) 59612.8676(1) 59630.4395(1) 59399.2389(1) 59415.5093(1) 59431.6159(1) 59580.8150(20) 59596.5971(1) 59613.0299(2) 59630.6018(2) 59399.4011(1) 59415.6712(1) 59431.7795(1) 59580.9779(1) 59596.7596(1) 59613.1929(1) 59630.7651(1) 59399.5645(1) 59415.8346(1) 59431.9413(1) 59581.1396(2) 59596.9225(1) 59613.3554(2) 59630.9274(2) 59399.7266(1) 59415.9966(1) 59432.1048(1) 59581.3035(1) 59597.0850(21) 59613.5184(1) 59631.0902(1) 59399.8894(1) 59416.1601(1) 59432.2669(1) 59581.4649(2) 59597.2479(1) 59613.6799(2) 59631.2528(3) 59400.0519(9) 59416.3219(1) 59432.4311(4) 59581.6291(1) 59597.4104(1) 59613.8436(8) 59631.4158(1) 59400.2153(1) 59416.4851(2) 59433.8933(5) 59581.7912(2) 59597.5735(1) 59614.0052(3) 59631.5770(29) 59400.3774(1) 59416.6475(1) 59434.0574(1) 59581.9541(1) 59597.7352(1) 59614.1695(1) 59631.7413(1) Continued on next page

18 KUDAK ET AL.

Table 8 – continued from previous page BJD BJD BJD BJD BJD BJD BJD 59400.5406(1) 59416.8109(1) 59434.2193(1) 59582.1166(2) 59597.8988(1) 59614.3307(3) 59631.9035(2) 59400.7028(1) 59416.9728(8) 59434.3823(2) 59582.2799(1) 59598.0612(2) 59614.4938(2) 59632.0666(1) 59401.0281(1) 59417.1365(2) 59434.5448(1) 59582.4412(2) 59598.2242(1) 59614.6582(4) 59632.2277(3) 59401.1915(1) 59417.2979(1) 59434.7082(1) 59582.6052(1) 59598.3865(1) 59615.1456(1) 59632.3921(1) 59401.3535(1) 59417.4616(1) 59434.8701(1) 59582.7674(2) 59598.5496(9) 59615.3078(2) 59632.5532(3) 59401.5168(1) 59417.6237(1) 59435.0337(1) 59582.9306(1) 59598.7114(1) 59615.4707(1) 59632.7176(1) 59401.6789(1) 59417.7871(1) 59435.1954(1) 59583.0928(2) 59598.8751(1) 59615.6333(2) 59632.8798(2) 59401.8423(1) 59417.9489(1) 59435.3589(1) 59583.2558(1) 59599.0375(2) 59615.7960(10) 59633.0428(1) 59402.0044(1) 59418.1126(2) 59435.5209(1) 59583.4182(2) 59599.2005(1) 59615.9575(2) 59633.2052(3) 59402.1675(1) 59418.2743(1) 59435.6843(1) 59583.5813(1) 59599.3628(1) 59616.1219(1) 59633.3679(1) 59402.3297(1) 59418.4379(1) 59435.8461(1) 59583.7427(2) 59599.5258(1) 59616.2839(2) 59633.5306(3) 59402.4929(1) 59418.5990(20) 59436.0097(1) 59583.9066(1) 59599.6876(2) 59616.4469(1) 59633.6938(1) 59402.6551(1) 59420.2257(4) 59436.1718(1) 59584.0691(2) 59599.8513(1) 59616.6093(2) 59633.8548(2) 59402.8185(1) 59420.3904(1) 59436.3351(1) 59584.2322(1) 59600.0136(1) 59616.7726(1) 59634.0191(1) 59402.9807(1) 59420.5522(1) 59436.4972(1) 59584.3944(2) 59600.1756(3) 59616.9348(2) 59634.1814(3) 59403.1442(2) 59420.7157(4) 59436.6606(1) 59584.5575(1) 59600.3387(4) 59617.0980(10) 59634.3442(1) 59403.3060(1) 59420.8776(1) 59436.8224(1) 59584.7199(2) 59600.5006(5) 59617.2602(2) 59634.5068(3) 59403.4694(1) 59421.0412(1) 59436.9859(1) 59584.8830(10) 59600.6648(5) 59617.4234(1) 59634.6695(1) 59403.6312(1) 59421.2028(1) 59437.1478(1) 59585.0452(2) 59600.8274(1) 59617.5856(2) 59634.8311(2) 59403.7945(1) 59421.3664(1) 59437.3113(1) 59585.2083(1) 59600.9891(2) 59617.7485(9) 59634.9950(10) 59403.9568(1) 59421.5285(1) 59437.4734(1) 59585.3706(2) 59601.1529(1) 59617.9110(20) 59635.1576(2) 59404.1201(1) 59421.6919(1) 59437.6367(1) 59585.5337(1) 59601.3146(2) 59618.0741(1) 59635.3204(1) 59404.2819(8) 59421.8538(1) 59437.7987(1) 59585.6960(21) 59601.4783(1) 59618.2355(2) 59635.4831(3) 59405.4201(5) 59422.0172(1) 59437.9621(1) 59585.8591(1) 59601.6406(2) 59618.3995(1) 59635.6457(1) 59405.5834(1) 59422.1790(1) 59438.1242(1) 59586.0213(2) 59601.8038(1) 59618.5617(2) 59635.8090(10) 59405.7470(1) 59422.3428(1) 59438.2875(1) 59586.1834(5) 59601.9651(2) 59618.7251(1) 59405.9091(1) 59422.5048(1) 59438.4496(1) 59586.3450(28) 59602.1290(1) 59618.8873(2) 59406.0724(6) 59422.6680(1) 59438.6129(1) 59586.5115(5) 59602.2913(1) 59619.0501(1) 59406.2347(1) 59422.8298(1) 59438.7748(1) 59586.6721(2) 59602.4545(9) 59619.2117(2) 59406.3979(1) 59422.9935(1) 59438.9384(1) 59586.8353(1) 59602.6169(2) 59619.3758(1)

TABLE 9: GSC 04364-0064 times of minima determined from TESS lightcurves. Errors are in parenthesis.

BJD BJD BJD BJD BJD BJD BJD 58842.925(2) 58848.963(1) 58851.983(4) 58858.454(2) 58864.494(2) 59014.199(3) 59019.375(4) 58843.356(4) 58849.391(4) 58851.985(3) 58858.886(3) 58864.926(3) 59014.632(1) 59019.809(2) 58843.786(1) 58849.394(4) 58852.414(1) 58859.749(4) 58865.789(3) 59014.634(1) 59020.241(3) 58845.512(2) 58849.826(2) 58852.415(2) 58860.609(4) 58867.085(2) 59015.498(2) 59020.672(1) 58845.513(1) 58849.827(1) 58852.844(4) 58861.473(4) 59011.179(2) 59015.923(4) 59020.674(2) 58845.937(4) 58850.259(4) 58853.709(4) 58862.338(4) 59012.045(2) 59016.789(4) 59021.534(2) 58845.945(4) 58850.687(2) 58854.140(8) 58862.767(2) 59012.476(4) 59017.648(4) 59026.712(1) 58846.374(2) 58850.688(2) 58856.727(2) 58862.768(2) 59012.906(2) 59018.085(2) 59029.729(4) 58846.376(2) 58851.119(4) 58857.158(4) 58863.199(4) 59012.907(2) 59018.086(2) 59031.888(2) 58846.804(4) 58851.552(1) 58857.593(2) 58863.634(2) 59013.335(4) 59018.514(3) 59033.614(2) 58848.101(2) 58851.553(2) 58858.022(4) 58864.065(4) 59013.773(2) 59018.946(2) 59034.481(2)

TABLE 10: Observed times of minima of selected EB systems. Errors are in parenthesis.

Name BJD Name BJD RU UMi 59277.4101(2) VY UMi 59516.3846(2) RU UMi 59467.4327(1) VY UMi 59517.3604(1) VY UMi 59298.3633(2) VY UMi 59517.5219(1) VY UMi 59298.5245(2) GSC 04364-0064 59343.3781(2) VY UMi 59516.2200(3) GSC 04364-0064 59374.4401(1)