arXiv:2206.02493v1 [astro-ph.SR] 6 Jun 2022

FG Sge: new multicolor photometry and short-term dust shell clearing in 2019

V.P. Arkhipova^1, N.P. Ikonnikova^{1∗}, V.I. Shenavrin^1, M.A. Burlak^1, A.M. Tatarnikov^1, D.Yu. Tsvetkov^1 , A.A. Belinskii^1, N.N. Pavlyuk^1, S.Yu. Shugarov^{1,2}

1Lomonosov Moscow State University, Sternberg Astronomical Institute, Moscow, Russia 2Astronomical Institute of the Slovak Academy of Sciences, Tatranska Lomnica, Slovakia

We present the results of a new stage of the long-term photometric study of FG Sge which is a quickly evolving central star of the planetary nebula Hen 1-5. Our new observations carried out on the SAI MSU telescopes in the optical (BV R_C I_C ) and infrared (IR) (JHKLM) regions in 2008–2021 and 2013–2021, respectively, allowed us to trace the evolution of the star’s brightness in recent years. The most significant observations were performed in 2019 when the star suffered a short clearing of the dust shell and became visible in BV R_C . Based on the spectral energy distribution of FG Sge in the 0.4–5 μm wavelength range we derived the dust shell parameters: the size of dust grains a = 0.01μm, the inner radius temperature T_{dust} = 900 K, optical depth τ(K) = 0.5 (τ(V ) = 4.5), the total mass of dust M_{dust} = 7 · 10^{−5}M_⊙. After the short-term clearing of the dust shell in 2019, another dust structure was ejected that resulted in the star fading in all the observed bands. Based on the IR brightness and color curves, we estimated the dust depth growth in 2019–2020.

Keywords: variable stars, photometric observations, central stars of planetary nebulae, evolution, dust shells, FG Sge

INTRODUCTION

The unique central star of the planetary nebula He1-5, which is a fast evolving variable star FG Sge, has been returning from the classic evolutionary track for a planetary nebula central star to the Asymptotic Giant Branch for more than 100 years. According to the state of the art, this was preceded by the last helium shell flash resulting in the star’s rapid cooling and expansion with the bolometric luminosity staying quite constant. Long-year observations of the star led to the conclusion that FG Sge went along the supergiant sequence from the B to K spectral type being a pulsating variable when crossing the instability strip and entered the R CrB phase with powerful dust ejections in 1992, which is still lasting nowadays. Photometric observations of the star carried out since 1992 (Woodward et al. 1993; Arkhipova et al. 1994, 1996; Gonzalez et al. 1998; Tatarnikov and Yudin 1998; Tatarnikov et al. 1998; Arkhipova et al. 2003, 2009; Taranova and Shenavrin 2002, 2013; Rosenbush and Efimov 2015) confirm the formation of a dust circumstellar envelope as a result of dust condensation in the ejecta from the star.

In 2019 Fadeyev published his stellar evolution calculations for population I stars with masses on the main sequence 1M_⊙ < M_{ZAMS} < 1.5M_⊙ up to the stage of a cooling white dwarf (Fadeyev, 2019).

∗e-mail: ikonnikova@sai.msu.ru

He showed that the final helium flash (LTP) occurs in post-AGB stars with initial masses 1.30 ÷ 1.32 M_⊙. A simulated model was applied to describe the evolution of FG Sge and the theoretical pulsation period was compared with the observational ones derived in different years. The maximum pulsation period P = 117 d determined for an evolved star with the initial mass M_{ZAMS} = 1.3M_⊙ and the overshooting parameter f = 0.016 was in a good agreement with an observational estimate P = 115 d (Arkhipova et al. 2003) derived later than 1992. Besides, Fadeyev determined the current mass M = 0.565M_⊙, temperature T_∗ = 4445 K and radius R_∗ = 126R_⊙ of the star (Fadeyev, 2019).

In this work, we present the multicolor observations of FG Sge carried out at various telescopes of SAI MSU in 2008-2021 in the 0.4-5 μm wavelength range and describe some recent episodes in its history.

OBSERVATIONS

BV R_C I_C -photometry in 2008-2021

We carried out photometric observations of FG Sge on several telescopes with various detectors in 2008-2021. In 2009-2015 we acquired some data with the 70-cm reflector AZT-2 based in Moscow and equipped with a Apogee Ap-7p CCD camera (M70). In 2008-2019, we also used the 60-cm reflector Zeiss-2 of the Crimean Astronomical Station of SAI MSU, equipped at different times with Apogee AP-47p (C60a), FLI PL 4022 (C60b) and Aspen CG42 (C60c) CCDs. A great amount of Johnson- Cousins BV R_C I_C photometric data was obtained in 2019-2021 with the use of the new telescope RC600 of the Caucasus Mountain Observatory (CMO) of SAI MSU equipped with an Andor iKon-L 2048×2048 CCD (the pixel size is 13.5 μm, 0.67 arcsec/pix)(for more detail, see Berdnikov et al. 2020). The Maxim DL software was used to perform observations as well as primary data reduction including dark correction, bias subtraction and flat fielding.

FG Sge varies significantly, so we used different comparison stars as photometric standards depending on the star’s actual brightness. When FG Sge was bright enough we usually used its optical companion (2MASS 20115664+2020031) located 7^{′′} to the east. The companion’s magnitudes were determined earlier in Arkhipova et al. (2003). The adopted magnitudes for the companion and fainter comparison stars are listed in Table 1. Fig. 1 shows the vicinity of FG Sge with the comparison stars marked.

Figure 1: The vicinity of FG Sge (var) with the comparison stars marked. The image was obtained on July 31, 2019 on the RC600 telescope in the R_C band.

The color terms needed to transform instrumental magnitudes to the standard B, V , R_C and

Table 1: Comparison stars Designation B V R_C I_C 1 13.84 12.33 11.54 10.77 2 16.18 15.39 14.97 14.63 3 16.22 14.64 13.80 12.98 4 15.92 15.06 14.61 14.11

I_C ones were determined for some telescope-filter-detector combinations using the equations from Tsvetkov et al. (2006).

The RC600 data obtained in 2019–2021 were transformed to the standard Johnson-Cousins system according to the following expressions: b = B − 0.061 · (B − V ) v = V + 0.027 · (B − V ) r = R_C + 0.076 · (V − R_C ) i = I_C + 0.074 · (R_C − I_C ), (1)

where bvri and BV R_C I_C are the instrumental and standard system magnitudes, respectively. The color terms were calculated using observations of standards in M67 and the photometry of Chevalier and Ilovaisky (1991).

We performed aperture photometry using the WinFITS utility created by V.P. Goranski. Our photometric precision is limited to 0.^m005 for the bright state and is not worse than 0.^m05 − 0.^m10 for deep minima.

In Table 2 we present the photometry for FG Sge obtained in 2008–2021 on the telescopes of SAI MSU.

JHKLM-photometry in 2013-2021

JHKLM-photometry for FG Sge has been performed on the 125-cm telescope of the Crimean Astronomical Station of SAI MSU with the InSb-photometer since 1985. A description of observational routine, instrumentation and observational data obtained in 1985–2008 can be found in Shenavrin et al. (2011). JHKLM-photometry for FG Sge taken in 2009–2013 is presented in Taranova and Shenavrin (2013). Our new data acquired in 2013–2021 are given in Table 3.

PHOTOMETRY ANALYSIS

Fig. 2 shows the V light and B − V color curves for 1992–2019 based on our photometry published in a series of papers in this journal in 1994–2009 and on new observations presented here.

In 1992–2009 the star displayed B and V light variations with an amplitude from 2 to 8 magnitudes, a general trend of decreasing mean brightness, a period of 115 d and a well-defined tendency to become bluer in the descending branch, which we discussed in detail in Arkhipova et al. (2009). But in 2010 the V light fell to 16^m and lower and we managed to measure the B brightness only in 2019, as will be described below.

Fig. 3 shows the I light and R − I color curves for 1998–2020 based on our data published in Arkhipova et al. (2003, 2009) and new observations taken in 2008–2020, the latter being transformed from the Cousins to Johnson system using the equations from Bessell (1979) and corrections obtained through simultaneous observations in the R_C and R bands.

Figure 2: The V light and B − V color curves for 1992–2019. New data are located to the right from the vertical dashed line.

Although FG Sge was undetectable in B and V , we managed to observe it in R and I all the time, and its RI behavior before and after 2009 can be seen in Fig. 3 with a mean I brightness fading up until 2019, a sudden rise to 10^m in 2019 and dimming to 18^m by early 2020. The R − I color had been getting regularly redder from 0.^m5 to 2.^m5 by 2011, and had decreased to 1.^m5 by the beginning of observations in 2019.

The pulsations were seen in R and I quite as well as in V and B but the R − I color did not get bluer when the star was dimming.

Fig. 4 and 5 show the IR light and color curves for FG Sge in 1994–2021 based on observations reported in Shenavrin et al. (2011), Taranova and Shenavrin (2013) and our new data. A detailed description of IR data acquired for FG Sge in 1993–2013 can be found in Taranova and Shenavrin (2013).

The object displayed large J and H variations of total light in 1994–2016 related to the pulsating variable star itself as well as to its dust shell; the variations show a general trend of dimming down to J ∼ 13^m and H ∼ 11^m and decreasing amplitude.

Then by 2019, the mean brightness in both bands suddenly increased by 3.^m5−4^m. And in 2019 we

Figure 3: The I light and R − I color curves in 1998–2020. New data are located to the right from the vertical dashed line.

observed a rapid drop in H brightness of about 5 magnitudes and stopped seeing the object in J that indicated a strong growth of the dust shell optical depth in both bands. In 2020 the object continued to decrease in H to an all-time low brightness of 11.^m62, whereas in 2021 it started brightening. The K brightness evolution was similar to that of H.

The dust shell brightened in L and M by 1^m and 0.^m8, respectively, from 1994 till 2019, and by the end of 2020 was fainter by 1.^m5 − 2.^m0. The 2021 observations showed a slight brightening of the object in these bands.

It was shown by Taranova and Shenavrin (2013) and can be seen from Fig. 5 that the object was monotonously reddening in the available IR range 1.25–5 μm till 2013. The reddening in the JHK bands was related to the growth of the dust shell optical depth in the line of sight, and in the farther IR region of 3.5–5 μm – to the receding of dust structures from the heating star and the decreasing of the dust shell temperature, as a consequence.

The behavior of the H − K, K − L and L − M colors significantly changed after 2013. So, varing with an amplitude of up to 1 magnitude the H − K color decreased in average from 2013 till early 2019. The object was also observed to get bluer in the 2.2–5 μm range (KLM). The H − K, K − L

Figure 4: JHKLM light curves for FG Sge in 1994–2021. New data are located to the right from the vertical dashed line.

and L−M colors increased substantially during a rapid fall of brightness in all IR bands in 2019–2020. An inverse phenomenon occurred in 2021 – the object was getting bluer when brighter.

Photometric observations of FG Sge in 2019–2021

We managed to detect FG Sge in the optical range (BV R_C ) in 2019 after several years of invisibility.

The light and color curves for FG Sge based on the RC600 observations in 2019 are rather well presented in Fig. 6. The star was faint again in 2020–2021 and we could detect it only in the I_C band at 18.^m1 − 18.^m5.

In 2019, after having brightened to 16.^m2 in B, the star declined by more than 3^m in 75 days and became invisible for observations.

We managed to measure the V brightness from V ∼ 13^m to V ∼ 19^m, whereas in the R_C and I_C bands we could trace the star declining from 11.^m56 to 19^m and from 10.^m12 to 18.^m0, respectively. The fading was caused by the growth of extinction in the line of sight due to mass loss from FG Sge via star wind and the formation of new dust structures. Fig. 7 shows the B − V and R_C − I_C color versus V and R_C brightness correlations. B − V got bluer by 0.^m4 and V − R_C – by 0.^m3 in 2019. The blueing is related to the presence of small particles in the newly formed dust shell that cause light scattering. When the brightness dropped to 18^m, R_C − I_C reddened from 1.^m4 to 2.^m0 and then

Figure 5: IR color curves for FG Sge in 1994–2021. New data are located to the right from the vertical dashed line.

recovered to ∼ 1.^m4.

We believe this behavior of R_C − I_C to be due to an interaction of pulsations with the enhanced mass loss occurring in those days. It should be noted that back in 2001 the star displayed an unusual double deep minimum of about V = 17^m, when the V − I color grew from 2.^m5 to 3.^m5–3.^m7 and then fell to 2.^m5 twice (Arkhipova et al. 2003).

The observations of FG Sge in 2019 revealed a rapid drop of brightness in optical range and a slower and smaller one in near IR (up to 5 μm).

In 2019 the IR brightness decreased by 3^m in J, 4.^m5 in H and 2.^m7 in K; the drop in L and M brightness of 1.^m0 and 0.^m8, respectively, was unusually large compared to the previous years. The star was fading in all the IR bands in 2020 and the K, L and M magnitudes reached the largest values ever observed by the end of 2020. The star turned red as never before. The H − K and L − M colors grew up to 3.^m2 and 1.^m3, respectively, on November 11, 2020 (JD2459165); K − L reached a record value of 4.^m29 on December 15, 2020. A few observations carried out in 2021 showed a slight brightening in KLM and a more significant one of 2^m in H, whereas the H − K and K − L colors decreased and L − M almost did not change.

Figure 6: Light and color curves for FG Sge based on the RC600 observations in 2019.

Spectral energy distribution and the dust shell parameters estimation

Multicolor photometry provides us an opportunity to derive absolute energy distribution in the spectrum of FG Sge and its dust shell if we manage to perform absolute calibration of all measured BV R_C I_C JHKLM magnitudes (Straižys 1977; Koornneef 1983; Bessell 1998).

In Fig. 8 we plot the absolute fluxes of the star in 2019–2020 dereddened with E(B − V ) = 0.^m4 (Arkhipova 1988).

One can see that the V , R_C and I_C fluxes decreased by almost 200 times in 73 days (JD2458634- 2458707) and the R_C and I_C fluxes – by 550 times in 163 days (JD2458634-2458797). The observed V , R_C , I_C and, to a varying degree, J and H luminosity is a sum of the central star radiation attenuated by the dust shell plus the scattered one. The K, L, M fluxes are emitted by the dust shell.

The dust shell of FG Sge has a complicated structure due to numerous episodes of mass loss and dust formation, and to the presence of clumps (which are responsible for the blueing of optical colors) that makes the modeling of the system a particularly challenging task. Nevertheless, one can estimate the basic parameters of the system with the simplest assumptions: a spherically symmetric shell was formed at a constant mass loss rate and contains small carbon grains (which are needed to provide a high degree of light scattering in the optical domain).

Based on the assumptions mentioned above, we simulated the spectral energy distribution for FG Sge in the 0.4–5.0 μm wavelength range for JD2458634 using the CSDUST3 code (Egan 1988). For

Figure 7: Color-brightness diagrams based on BV and R_C I_C observations.

calculations we adopted the stellar parameters from Fadeyev (2019): T_∗ = 4445 K and R_∗ = 126R_⊙.

The resulting model curve is shown by a dashed line in Fig. 8. The energy distribution observed before the abrupt decline in 2019 could be simulated only by assuming the presence of very small dust grains: a = 0.01 μm and less. The following parameters of the shell were derived: the inner radius ∼ 40R_∗, the inner radius dust temperature 900 K, the optical depth τ(K) = 0.5 (τ(V ) = 4.5), the total mass of dust M_{dust} = 7 · 10^{−5}M_⊙.

In 2019 FG Sge displayed a significant decline in brightness (by more than 4 times) observed in a wide wavelength range reported here. This phenomenon together with the 5 μm flux decreasing could have been explained by a thick absorbing cloud having appeared in the line of sight; the cloud obscured the central star and a substantial part of the hot dust shell. But the large characteristic size of this part of the shell (tens of a.u.) and relatively short durance of the decline suggest large enough velocities for the cloud (of the order of 1000 km/s) which is implausible. Another scenario that can qualitatively explain the observed decline of brightness is that a new very dense spherically symmetric dust shell is formed around the central star. In order to avoid additional radiation in the observed wavelength range, the shell ought to be optically thick to its own near-IR emission. In this case, the already existing shell having lost the heating source will decrease its temperature and the maximum of its radiation will move to the mid-IR region.

Multicolor photometry allowed us to estimate the change in optical depth along the line of sight for the star and dust shell in 2019-2020. Based on the first observation of FG Sge with the new forming shell in 2019 (JD2458634) and considering the interstellar extinction, we derived J_0 = 7^m.54, H_0 = 6.^m41 and (J − H)_0 = 1.^m13. Given that the star’s normal brightness in J is J_0 = 6^m.59 (Taranova and Shenavrin 2013), the total optical depth in J has changed by nearly one magnitude.

After 108 days (JD2458738), our observations yielded J_0 = 10^m.43, H_0 = 8.^m33, (J −H)_0 = 2.^m10. This change in total light could well have been considered as a sufficient means for estimating the growth of the dust optical depth in J in 108 days that would have been equal to Δτ(J) = A_λ/0.912 = (10.43 − 7.54)/0.912 = 3.10. But an optical light minimum (pulsational?) was observed around this date in the V , R_C , I_C bands together with a clear blueing of the B − V color; since the star could have its own light minimum, it would have been wrong to use the total J magnitude for this date for optical depth calculations.

The IR brightness had been decreasing until the end of 2020; as the object became invisible in J,

Figure 8: Spectral energy distribution of FG Sge in 2019–2020 corrected for interstellar extinction. The JDs for the observations are given. A dashed line represents a model curve for JD2458634.

we turned to the KL bands to estimate the optical depth in 2020. The (K − L) − K color-brightness diagram (Fig. 9) demonstrates the way the brightness decreased and the color increased in 2019–2020 (JD2458630-2459199). Linear fitting of data gives an expression: ΔK = (1.81 ± 0.36)Δ(K − L). The correlation coefficient is 0.98. According to the normal extinction law for the IR region ΔK = 2.0Δ(K − L) (Koornneef 1983), so, the slopes of the regression lines for the extinction law and for the observed relationship coincide with each other within the error limits. Based on this issue, we can conclude that the optical properties of grains in the new dust shell of FG Sge are similar to those of the interstellar ones.

The K brightness decreased by 3.^m66 in 569 days (JD2458630-2459199) that gives an increase of the dust optical depth in K of Δτ(K) = A_λ/0.912 = 3.66/0.912 = 4.0.

CONCLUSIONS

In this study, we carried out optical photometric observations of FG Sge in 2008–2021 and near-IR ones in 2013–2021, confirmed the star to be active after the ejection of dust shell in 1992 and described the way the dust forms and evolves.

The star was fainter than 16^m in V in 2010–2018 and invisible in B till 2019, whereas it displayed two notable R_C and I_C light maxima. A short-time clearing of the dust shell occurred in the early 2019 that caused a rise in brightness to V = 13.^m2 and B = 16.^m2. Then, another dusty structure was ejected and the star’s brightness dropped quite quickly in all the observed bands. The star stayed visible in B for 75 nights, in V for 93 nights and in R_C for 206 nights and then again turned invisible in these bands for our telescopes. The use of the new RC600 telescope with a modern CCD camera since 2019 provided an increase in limiting brightness for the I_C observations. So, we had been obtaining I_C data during the deep light minimum till the end of 2021 and managed to measure the star’s brightness of 18.^m1 − 18.^m5 in 2020–2021.

It’s worth mentioning that a clear blueing of the B−V color occurred in 2019 during the descending branch of light curve. Such a phenomenon was observed during deep light minima more than once as

Figure 9: Color-brightness diagram for the 2019–2020 data. Black dots correspond to our observations. The dashed line represents linear fit. The reddening vector is shown by an arrow.

reported, e.g., in Arkhipova et al. (1994, 2003, 2009). This behavior is also observed in R CrB stars during deep minima and is a characteristic feature of young variable UX Ori stars. Current studies interpret this phenomenon as a consequence of enhanced scattering of the central star radiation by the circumstellar dust. Grinin (1988) was the first to introduce a model explaining the blueing of two young irregular variables UX Ori and WW Vul during deep light minima; the detection of linear polarization for the UX Ori stars confirmed the model. Based on the idea, Pugach (1988) proposed a phenomenological model for the deep light fading in R CrB that described correctly not only the shape of color tracks in color-brightness diagrams but also the direction in which the star moved along the tracks.

Based on the spectral energy distribution obtained before FG Sge started to descend into the 2019 deep minimum we derived the dust shell parameters for JD2458630: dust grain size a = 0.01μm, the inner-radius temperature T_{dust} = 900 K, the optical depth τ(K) = 0.5 (τ(V ) = 4.5), the total mass of dust in the shell M_{dust} = 7 · 10^{−5}M_⊙.

The shell created in 2019 was characterized by an extraordinarily large optical depth. For the first time since FG Sge had started to eject dust shells (i.e. since 1992) it displayed a significant light fading in mid-IR, too (the L and M bands). We have proposed a scenario which qualitatively explains the observed fading. In order to avoid additional radiation in the observed wavelength range, this new dust structure ought to be optically thick even to its own near-IR emission. In this case, the already existing shell having lost the heating source will decrease its temperature and the maximum of its radiation will move to the mid-IR region. Indeed the increase in optical depth caused the light fading in all the observed bands. From the first observation in 2019 till the end of 2020 (569 days) the optical depth in K grew by Δτ(K) ∼ 4.0.

In conclusion, we wish to draw attention to the new estimate of distance to FG Sge obtained from the Gaia EDR3 results (Brown et al. 2021). Bailer-Jones et al. (2021) derived D = 2278^{+1475}_{−748} pc. This distance leads to the star’s mean luminosity in the epoch preceding the start of dust ejections in 1992 of lg L/L_⊙ = 3.44, if the mean value for FG Sge in 1991 V = 9.^m2 (Arkhipova et al. 2003) and E(B − V ) = 0.^m4 (Arkhipova 1988) are used. The star’s V brightness during the pulsational maximum of 1991 gives a luminosity higher by 0.^m3: lg L/L_⊙ = 3.74. Our estimates of the FG Sge luminosity obtained using the stellar parallax from EDR3 agree with the values assumed in Fadeyev (2019).

ACKNOWLEDGMENTS

This study was carried out using the equipment purchased with the funds of M.V. Lomonosov Moscow State University Program of Development. The work of one of the co-authors (SYS) was supported by grands from the Slovak Academy of Sciences VEGA 2/0030/21 and APVV-20-0148.

REFERENCES

1. V.P. Arkhipova, Perem. Zvezdy 22, 631 (1988).

2. V.P. Arkhipova, G.V. Zaitseva, N.P. Ikonnikova, R.I. Noskova, and S.Yu. Shugarov, Astron.

Lett. 20, 801 (1994).

3. V.P. Arkhipova, G.V. Zaitseva, N.P. Ikonnikova, R.I. Noskova, and S.Yu. Shugarov, Astron.

Lett. 22, 750 (1996).

4. V.P. Arkhipova, N.P. Ikonnikova, G.V. Komissarova, R.I. Noskova, S.Yu. Shugarov, and V.F.

Esipov, Astron. Lett. 29, 763 (2003).

5. V.P. Arkhipova, V.F. Esipov, N.P. Ikonnikova, G.V. Komissarova, and S.Yu. Shugarov, Astron.

Lett. 35, 534 (2009).

6. C.A.L. Bailer-Jones, J.Rybizki, M. Fouesneau, et al., Astron. J. 161, 147 (2021). 7. L.N. Berdnikov, A.A. Belinskii, N.I. Shatskii, et al., Astron. Rep. 64, 310 (2020). 8. M.S. Bessell, Publ. Astron. Soc. Pacific 91, 589 (1979).

9. M.S. Bessell, F. Castelli, and P. Planesas, Astron. Astrophys. 333, 231 (1998). 10. A.G.A. Brown, A. Vallenari, T. Prusti, et al. (Gaia Collab.), Astron. Astrophys. 649, A1 (2021).

11. C. Chevalier and S.A. Ilovaisky, Astron. and Astrophys. Suppl. Ser. 90, 225 (1991). 12. M.P. Egan, C.M. Leung, and G.F. Spagna, Computer Physics Communication. 48, 271 (1988). 13. Yu.A. Fadeyev, Astron. Lett. 45, 655 (2019).

14. G. Gonzalez, D.L. Lambert, G. Wallerstein, et al., Astrophys.J. Suppl. Ser. 114, 133 (1998). 15. V.P. Grinin, Soviet Astronomy Letters 14, 27 (1988). 16. J. Koornneef, Astron. Astrophys. 128, 84 (1983). 17. A.F. Pugach, Soviet Astronomy 35, 61 (1991).

18. A.E. Rosenbush and Yu.S. Efimov, Astrophysics, 58, 46 (2015).

19. V.I. Shenavrin, O.G. Taranova, and A.E. Nadzhip, Astron. Rep. 55, 31 (2011).

20. V. Straižys Multicolor stellar photometry (Vilnius: Mokslas Publishers, 1977)

21. O.G. Taranova and V.I. Shenavrin, Astron. Rep. 46, 1010 (2002).

22. O.G. Taranova and V.I. Shenavrin, Astron. Lett. 39, 781 (2013).

23. A.M. Tatarnikov and B.F. Yudin, Astron. Lett. 24, 303 (1998).

24. A.M. Tatarnikov, V.I. Shenavrin, and B.F. Yudin, Astron. Rep. 42, 377 (1998).

25. D.Yu. Tsvetkov, A.A. Volnova, A.P. Shulga, et al., Astron. Astrophys. 460, 769 (2006).

26. C.E. Woodward, G.F. Lawrence, F.D. Gehrz, et al., Astrophys.J. 408, 37, (1993).

Table 2: Photometric observations of FG Sge in 2008–2021.

JD B V R_C I_C Telescope+ camera 2454781.17 – – 16.973 15.047 C60a 2454787.18 – 18.418 17.264 15.047 C60a 2454795.15 – – 17.394 14.907 C60a 2454956.45 – – – 15.707 M70 2455001.37 – – 18.163 15.207 C60a 2455009.42 – – – 15.607 C60a 2455043.40 – – – 15.907 M70 2455054.36 – – – 15.807 M70 2455076.29 – – 18.722 16.107 M70 2455145.20 – – 18.843 16.007 C60a 2455367.52 – 17.628 15.823 13.457 C60a 2455407.51 – – 16.183 13.987 C60a 2455448.34 – 16.995 14.832 12.777 M70 2455454.37 – 16.666 14.482 12.455 M70 2455474.27 – 16.405 14.502 12.207 M70 2455477.29 – 16.425 14.642 12.247 M70 2455488.28 – 16.715 14.882 12.487 M70 2455494.26 – 16.525 14.812 12.607 M70 2455501.22 – 16.655 14.842 12.607 M70 2455514.21 – 16.248 14.614 12.657 C60a 2455518.21 – 16.268 14.714 12.727 C60a 2455525.20 – 16.418 15.163 13.257 C60a 2455678.51 – – – 15.607 M70 2455701.46 – – – 15.907 M70 2455712.45 – – – 15.927 M70 2455725.52 – – – 15.887 C60a 2455726.53 – – – 15.847 C60a 2455728.49 – – – 15.867 C60a 2455732.51 – – – 15.727 C60a 2455744.36 – – 18.264 15.607 C60a

Table 2 – JD B V R_C I_C Telescope+ camera 2455749.38 – – 18.633 15.707 C60a 2455753.43 – – 18.823 15.747 C60a 2455755.38 – – 18.644 15.667 C60a 2455757.39 – – 18.733 15.657 C60a 2455783.45 – – 18.573 15.507 C60a 2455789.41 – – 18.453 15.667 C60a 2455874.21 – – – 15.897 C60a 2455879.20 – – – 15.857 C60a 2456118.48 – – – 16.836 C60a 2456447.44 – – 17.872 15.599 M70 2456490.39 – – 17.944 15.137 C60a 2456492.44 – – 17.964 15.207 C60a 2456493.47 – – 17.994 15.137 C60a 2456532.32 – – 17.834 15.117 C60a 2456537.37 – – 17.843 15.247 C60a 2456921.42 – – – 17.067 M70 2456937.45 – – – 17.027 M70 2456967.22 – – – 17.167 C60a 2457253.43 – – 17.273 14.886 C60b 2457257.31 – – 16.649 14.311 C60b 2457330.12 – 16.695 14.432 12.167 M70 2457333.11 – 16.715 14.532 12.277 M70 2457340.28 – 17.360 15.030 13.230 C60b 2457344.14 – 17.201 15.333 13.090 C60b 2457355.50 – – 16.202 13.577 M70 2457602.50 – – – 16.460 C60b 2457978.29 – – – 16.282 C60c 2457992.27 – – – 16.447 C60c 2458338.37 – 16.665 14.687 12.974 C60c 2458340.28 19.169 16.431 14.506 12.818 C60c 2458360.43 – 14.358 12.789 C60c 2458361.49 – 16.335 14.459 12.871 C60c 2458362.47 – 16.417 14.556 12.970 C60c 2458369.30 – 16.956 15.161 13.502 C60c 2458371.38 – 17.012 15.246 13.584 C60c 2458379.36 – 17.234 15.451 13.741 C60c 2458380.39 – 17.267 15.456 13.730 C60c 2458618.49 16.228 13.231 11.508 10.049 C60c 2458634.50 16.428 13.198 11.498 10.072 RC600 2458635.50 16.471 13.319 11.550 10.133 RC600 2458642.50 16.608 13.514 11.742 10.315 RC600 2458650.41 16.851 13.839 12.035 10.582 RC600 2458657.38 17.102 14.093 12.321 10.849 RC600 2458662.45 17.286 14.329 12.581 11.130 RC600 2458666.42 17.552 14.595 12.845 11.370 RC600

Table 2 – JD B V R_C I_C Telescope+ camera 2458667.39 17.563 14.645 12.899 11.425 RC600 2458668.40 17.697 14.737 12.969 11.500 RC600 2458669.46 17.729 14.809 13.045 11.558 RC600 2458672.35 17.971 15.011 13.240 11.755 RC600 2458675.45 18.095 15.183 13.401 12.046 RC600 2458679.41 18.298 15.422 13.686 12.318 RC600 2458691.52 – – 15.165 13.665 RC600 2458693.42 19.956 17.171 15.350 13.842 RC600 2458694.35 – 17.251 15.641 13.959 RC600 2458696.40 – 17.635 15.882 14.322 RC600 2458699.50 – 17.95 16.380 14.704 RC600 2458703.48 – – – 14.918 RC600 2458707.38 – – – 15.018 RC600 2458708.32 – 18.729 17.044 15.026 RC600 2458711.40 – 18.629 17.224 15.086 RC600 2458716.40 – – 17.535 – RC600 2458718.43 – – 17.738 15.672 RC600 2458719.33 – – 17.898 – RC600 2458722.40 – – 17.718 – RC600 2458724.40 – – 17.788 16.124 RC600 2458727.40 – – 17.932 – RC600 2458730.40 – – 17.942 16.155 RC600 2458732.35 – – 18.173 16.144 RC600 2458740.40 – – 18.202 16.032 RC600 2458741.27 – – 18.198 16.096 RC600 2458742.43 – – 18.142 16.032 RC600 2458744.35 – – – 16.068 RC600 2458745.30 – – – 16.044 RC600 2458749.37 – – – 16.218 RC600 2458750.24 – – 18.124 16.148 RC600 2458761.22 – – 18.006 16.163 RC600 2458766.25 – – 18.107 16.372 RC600 2458767.22 – – – 16.291 RC600 2458769.22 – – – 16.513 RC600 2458770.33 – – 17.958 16.458 RC600 2458771.30 – – 18.106 16.458 RC600 2458773.22 – – 18.136 16.500 RC600 2458774.25 – – – 16.632 RC600 2458777.17 – – – 16.650 RC600 2458778.25 – – 18.116 16.650 RC600 2458779.20 – – 18.304 16.748 RC600 2458780.23 – – 18.345 16.720 RC600 2458781.27 – – 18.502 16.828 RC600 2458783.18 – – 18.492 16.841 RC600 2458784.18 – – – 16.905 RC600

Table 2 – JD B V R_C I_C Telescope+ camera 2458785.17 – – 18.562 16.835 RC600 2458786.18 – – 18.573 16.832 RC600 2458790.24 – – – 16.730 RC600 2458792.21 – – 18.694 16.879 RC600 2458793.23 – – 18.413 16.916 RC600 2458794.19 – – 18.506 17.006 RC600 2458795.22 – – 18.459 17.021 RC600 2458800.21 – – – 17.188 RC600 2458805.18 – – 18.801 17.113 RC600 2458807.18 – – 18.643 17.283 RC600 2458808.16 – – 18.895 17.333 RC600 2458811.17 – – 18.640 17.305 RC600 2458813.14 – – 18.760 17.393 RC600 2458824.17 – – 18.890 17.568 RC600 2458948.55 – – – 17.846 RC600 2458958.51 – – – 17.710 RC600 2458997.50 – – – 18.004 RC600 2459006.50 – – – 17.976 RC600 2459028.47 – – – 18.303 RC600 2459030.50 – – – 18.469 RC600 2459051.40 – – – 18.175 RC600 2459055.50 – – – 18.446 RC600 2459060.43 – – – 18.515 RC600 2459070.43 – – – 18.318 RC600 2459166.20 – – – 18.519 RC600 2459185.16 – – – 18.560 RC600 2459471.29 – – – 18.128 RC600 2459514.20 – – – 18.424 RC600 2459524.19 – – – 18.461 RC600 2459555.13 – – – 18.501 RC600

Table 3: JHKLM-photometry of FG Sge in 2013–2021. JD J σJ H σH K σK L σL M σM 2456467.5 10.65 0.06 9.27 0.03 6.89 0.01 3.81 0.01 2.89 0.02 2456472.5 10.84 0.08 9.18 0.03 6.88 0.01 3.84 0.01 2.88 0.01 2456485.5 11.09 0.07 9.38 0.01 6.92 0.01 3.82 0.01 2.90 0.01 2456492.4 10.78 0.07 9.09 0.02 6.94 0.01 3.91 0.01 2.92 0.01 2456514.4 11.44 0.06 9.58 0.02 7.07 0.01 3.91 0.01 3.02 0.02 2456524.4 11.43 0.07 9.74 0.03 7.10 0.01 3.85 0.01 2.86 0.01 2456587.2 10.99 0.11 9.82 0.06 7.36 0.01 4.01 0.01 2.88 0.02 2456591.2 11.02 0.06 10.01 0.04 7.35 0.01 3.99 0.01 2.91 0.02 2456848.5 - - 10.58 0.12 8.01 0.01 4.27 0.02 3.17 0.03 2456876.4 10.74 0.09 10.13 0.08 8.07 0.02 4.36 0.02 3.08 0.02 2456937.3 - - 10.89 0.06 8.12 0.02 4.31 0.02 3.17 0.02 2457205.4 - - 10.88 0.11 8.21 0.02 4.31 0.01 3.10 0.02 2457241.4 - - 10.33 0.05 7.90 0.01 4.33 0.02 3.12 0.02 2457265.3 - - 8.83 0.02 7.11 0.01 4.08 0.01 2.94 0.02 2457289.3 11.13 0.09 9.30 0.07 7.30 0.01 4.10 0.01 2.91 0.02 2457328.2 9.84 0.02 8.43 0.02 6.77 0.01 3.93 0.01 2.97 0.02 2457561.5 12.48 0.23 9.82 0.04 7.14 0.01 3.78 0.01 2.76 0.01 2457586.5 10.54 0.06 9.14 0.04 7.03 0.02 3.85 0.02 2.70 0.02 2457620.4 - - 9.62 0.04 7.28 0.01 3.87 0.02 2.86 0.02 2457643.4 10.57 0.06 9.13 0.02 7.28 0.01 3.89 0.01 2.85 0.02 2457943.5 - - 9.49 0.04 7.02 0.01 3.76 0.01 2.65 0.01 2457970.5 - - 9.44 0.02 6.85 0.01 3.68 0.01 2.68 0.01 2458006.3 - - 9.31 0.02 6.84 0.01 3.67 0.01 2.69 0.02 2458254.5 10.92 0.04 8.82 0.01 6.57 0.01 3.56 0.01 2.65 0.01 2458333.4 9.97 0.03 8.30 0.01 6.47 0.01 3.62 0.01 2.69 0.02 2458361.4 9.88 0.02 8.32 0.01 6.53 0.01 3.64 0.01 2.71 0.01 2458386.3 10.10 0.03 8.40 0.01 6.46 0.01 3.58 0.01 2.65 0.02 2458410.2 10.11 0.02 8.34 0.01 6.41 0.01 3.51 0.01 2.57 0.01 2458630.5 7.86 0.01 6.61 0.01 5.34 0.01 3.13 0.01 2.38 0.01 2458656.5 8.36 0.01 7.01 0.01 5.55 0.01 3.18 0.01 2.44 0.01 2458684.5 9.62 0.02 7.84 0.01 5.94 0.01 3.26 0.01 2.42 0.01 2458707.3 10.44 0.04 8.32 0.01 6.17 0.01 3.25 0.01 2.43 0.02 2458738.3 10.76 0.04 8.52 0.02 6.34 0.01 3.32 0.01 2.33 0.01 2458773.3 - - 8.88 0.02 6.50 0.01 3.44 0.01 2.49 0.01 2458798.2 - - 9.17 0.02 6.70 0.01 3.48 0.01 2.50 0.01 2458981.5 - - 9.88 0.09 7.56 0.01 3.92 0.01 2.85 0.02 2459030.5 - - 10.59 0.11 7.84 0.01 4.06 0.01 2.97 0.01 2459068.4 - - 11.03 0.12 8.06 0.01 4.16 0.02 2.93 0.02 2459165.2 - - 11.62 0.11 8.44 0.03 4.66 0.02 3.36 0.02 2459199.2 - - - - 9.00 0.02 4.71 0.01 3.47 0.02 2459394.4 - - - - 8.76 0.05 4.65 0.02 3.37 0.03 2459420.4 - - 10.08 0.08 8.07 0.02 4.55 0.01 3.27 0.02 2459450.4 - - - - 8.55 0.02 4.45 0.02 3.30 0.02 2459517.2 - - 9.47 0.06 8.24 0.02 4.56 0.01 3.22 0.02