arXiv:2201.02541v1 [astro-ph.SR] 7 Jan 2022

Draft version January 10, 2022 Typeset using L^ATEX default style in AASTeX631

The historic K_s light curve of the FUor PGIR20dci

Klaus W. Hodapp,^1 Scott E. Dahm,^2 and Watson P. Varricatt^1

1University of Hawaii, Institute for Astronomy, 640 N. A’ohoku Place, Hilo, HI 96720, USA 2U.S. Naval Observatory, Flagstaff Station, 10391 West Naval Observatory Road, Flagstaff, AZ 86005-8521, USA

Submitted to AAS Research Notes

ABSTRACT We report a historic K_s-band light curve spanning over three decades of the FUor PGIR20dci recently discovered by Hillenbrand et al. (2021) . We find some minor variability of the object prior to the FUor outburst, an initial rather slow rise in brightness, followed in 2019 by a much steeper rise to the maximum.

Keywords: Young stellar objects (1834) — Eruptive variable stars (476) — FU Orionis stars (553) —

1. INTRODUCTION The FUor eruption of the Class I object PGIR20dci in the NGC281W star-forming region was recently discovered by Hillenbrand et al. (2021) in the Palomar Gattini Infrared (PGIR) survey. Their near-infrared spectroscopy confirmed that this object is currently undergoing a FUor (Herbig 1977) outburst. The published light curve relied on Spitzer, WISE and NEOWISE photometry, with WISE having rather poor spatial resolution. This Research Note reports the pre-outburst and outburst light curve based on ground-based K_s-band images.

2. OBSERVATIONS AND RESULTS We have extracted aperture photometry from K-band images of PGIR20dci in our data archive, using the same 2.^{′′}25 aperture radius as was used by Hillenbrand et al. (2021) for their K_s data point. The first image was obtained in 1990 as part of the K^′ filter imaging survey of star-forming regions by Hodapp (1994). Follow-up imaging data were obtained in K^′ using the QUIRC (Hodapp et al. 1996) camera on the UH 2.2m telescope in 1998, 2002, and 2004. Later, three sets of images were obtained using WIRCam (Puget et al. 2004) on the CFHT telescope in 2011 and 2012 using a K_s filter. PGIR20dci was recorded with WFCAM (Casali et al. 2007) on UKIRT as part of the US Naval Observatory UKIRT Northern Hemisphere K-band survey UHSK (Dahm et al. 2018) in 2019. Finally, two outburst images in K were obtained with UKIRT WFCAM in 2021. The photometric calibration is based on a set of 25 2MASS (Skrutskie et al. 2006) stars with perfect 2MASS photometry flags common to all the K-band images used here. Based on the color information near maximum by Hillenbrand et al. (2021) and interpolation of the color corrections given by (Wainscoat & Cowie 1992) we correct the early K^′ photometry towards brighter values by subtracting 0.08 mag, and we correct the WFCAM photometry by adding 0.12 mag, so that the data shown in Fig. 1 and listed in Table 1 are effectively in the K_s system. For clarity, we list the filter used in each observation in Table 1. We include two upper limits at J = 21 mag based on the non-detection of the object in the UKIRT Hemisphere Survey in J (UHSJ) (Dye et al. 2018) and the image published by Megeath & Wilson (1997). In either image, only a faint extended ”smudge” is visible at the position of the reflection nebula, as was noted by Hillenbrand et al. (2021). We show the J brightness at the plateau level from Hillenbrand et al. (2021) as a single datum (green X) at J = 14.5

Corresponding author: Klaus Hodapp hodapp@ifa.hawaii.edu

2 Hodapp et al.

Figure 1.

Ks-band light curve of PGIR20dci based on ground-based observations. All observations have been transformed into effectively the Ks band. The color of the symbols indicates the original filter of the observations: K^′ (orange), Ks (red), and K (dark red). For comparison, we also show the WISE and NEOWISE band 2 data points (black circles), as well as the Spitzer space telescope data in the IRAC bands 1 (grey X) and 2 (black X) bands reported by Hillenbrand et al. (2021) after color transformation into the WISE photometric system. The flux of a constant star ≈ 5^{′′} to the north has been subtracted from the WISE-2 data points. We show the J-band upper limit, the average plateau brightness reported by Hillenbrand et al. (2021) in green and also include their Ks data point in red. All magnitudes are shifted to match the outburst plateau Ks level. The photometric errors are ≈0.1 mag, about the size of the filled circles used to indicate the data. The outburst amplitudes in all the bands shown here are indicated by the arrows on the left side of the Figure. The 30^{′′}×30^{′′} images are Spitzer IRAC images from 2009 Sept. 3 and WISE images taken between Jan. 2010 and Feb. 2011. The WISE catalog positions are indicated by green crosses.

(but shifted in Fig. 1).

PGIR20dci 3

Table 1. Ks Photometry of PGIR20dci

MJD K_s Error Orig. Filter

48142 16.74 0.10 K^′ 51085 16.56 0.10 K^′ 52592 16.74 0.10 K^′ 53218 16.91 0.10 K^′ 55823 16.80 0.10 K_s 56152 16.95 0.10 K_s 56152 16.86 0.10 K_s 56213 16.39 0.10 K_s 58487 14.49 0.10 K 59089 11.77 0.10 K_s 59447 11.74 0.10 K 59481 11.73 0.10 K

3. DISCUSSION The UH 2.2m and CFHT data between MJD 48000 (≈ 1990) and 56500 (≈ 2011) show only minor variations in the range of approximately 0.5 mag, which we consider significant compared to the 0.1 mag errors. The Spitzer and WISE photometry presented by Hillenbrand et al. (2021) had indicated a step increase of ≈ 2 mag in band 1 at wavelengths of 3.4 μm, and a similar, though smaller, step in WISE band 2 at 4.5 μm, between MJD 55080 (2009) and 55222 (2010). Our K_s-band data do not show a similar step up in brightness between the UH 2.2m photometry prior to MJD 54000 and the CFHT photometry around MJD 56000. We note that the WISE catalog profile-fitting positions and photometry are affected by the blending of the signal of the FUor with extended emission and another star’s flux ≈ 5^{′′} north of PGIR20dci seen in the Spitzer images in Fig. 1. Under the assumption that the flux ratio of that star to the FUor measured on the Spitzer image from 2009 also represents their flux ratio in the blended first WISE data point from 2010, we subtract the star’s flux from this and all the other WISE measurements resulting in the light curve indicated by black dots in Fig. 1 that shows a steady increase in brightness over the decade of the 2010s. This technique works quite well, though not perfectly, for WISE band 2, where only a ≈ 0.4 mag discontinuity between the last Spitzer and first WISE data point remains that can be explained by the extended emission near PGIR20dci visible in the Spitzer band 1 and 2 images in Fig. 1. This technique of subtracting the neighboring star’s flux does not work equally well for Spitzer band 1, where PGIR20dci is fainter than that constant star and the nebulous background is stronger. The variations of a few tenths of magnitudes in the K_s band, as well as the difference between the two Spitzer epochs indicate minor variations of PGIR20dci prior to the onset of the steady brightening sometime around 2014. Both the K_s data point at MJD 58487 (2019) and coincident NEOWISE data points are roughly half-way, in magnitudes, between the quiescent levels and the outburst plateau level. After this time, a much more rapid rise to the light curve maximum is indicated by two NEOWISE data points prior to the discovery of the outburst by Hillenbrand et al. (2021). The outburst amplitudes measured in K_s and in the WISE photometric system are indicated by arrows in Fig. 1. They show the familiar trend of smaller amplitudes at longer wavelengths. The outburst of PGIR20dci reached a plateau around MJD 58900 (February 2020) and has held this level at least until September of 2021.

4. SUMMARY AND CONCLUSIONS We have presented a historic light curve of the recently discovered FUor outburst PGIR20dci. The minor variations prior to the outburst are typical of T Tauri stars, the precursors of most FUor outbursts. The step increase in brightness reported by Hillenbrand et al. (2021) is not confirmed by our K_s-band light curve, but can be explained by blending with the flux of another nearby star and extended emission. The transition from a slow to a rapid rise in brightness halfway to the maximum is remarkable. The outburst amplitude is decreasing with wavelength. PGIR20dci has now reached a stable maximum brightness.

4 Hodapp et al.

This work uses imaging data from the WFCAM at the UKIRT observatory and from the NICMOS3 and QUIRC instruments at the UH 88” telescope, both operated by the University of Hawaii. One data point is from the UHS-K survey done at UKIRT with funding from the U.S. Naval Observatory. Some data were obtained with WIRCam, a joint project of CFHT, Taiwan, Korea, Canada, France, at the Canada-France-Hawaii Telescope (CFHT). The photometry is based on data products from the Two Micron All Sky Survey. We thank Mike Irwin of the Cambridge Astronomical Survey Unit at University of Cambridge for his work in reducing the UKIRT data, and Lynne Hillenbrand for helpful discussions.

Facilities: UH:2.2m, CFHT, UKIRT, WISE, Spitzer

REFERENCES Casali, M., Adamson, A., Alves de Oliveira, C. et al. 2007,

A&A, 467, 777 Dahm, S., Bruursema, J., Munn, J. A., et al. 2018, AAS

Meeting Abstracts Dye, S., Lawrence, A., Read, M. A., et al. 2018, MNRAS,

473, 5113. doi:10.1093/mnras/stx2622 Herbig, G. H. 1977, ApJ, 217, 693 Hillenbrand, L. A., De, K., Hankins, M., et al. 2021, AJ,

161, 220. doi:10.3847/1538-3881/abe406 Hodapp, K.-W. 1994, ApJS, 94, 615. doi:10.1086/192084

Hodapp, K.-W., Hora, J. L., Hall, D. N. B., et al. 1996, NewA, 1, 177. doi:10.1016/S1384-1076(96)00013-9 Megeath, S. T. & Wilson, T. L. 1997, AJ, 114, 1106.

doi:10.1086/118541 Puget, P., Stadler, E., Doyon, R., et al. 2004, Proc. SPIE, 5492, 978. doi:10.1117/12.551097 Skrutskie, M. F., Cutri, R. M., Stiening, et al. 2006, AJ, 131, 1163 Wainscoat, R. J. & Cowie, L. L. 1992, AJ, 103, 332.

doi:10.1086/116064