arXiv:2112.08123v1 [astro-ph.IM] 15 Dec 2021

APEX Control System (APECS): Recent improvements and plans

Dirk Muders,^1 Carsten König,^1 Reinhold Schaaf,^2 Felipe Mac-Auliffe,^3 and Juan-Pablo Pérez-Beaupuits^3

1Max-Planck-Institut für Radioastronomie, Bonn, Germany; dmuders@mpifr.de

2Argelander-Institut für Astronomie, Bonn, Germany

3European Southern Observatory, Santiago de Chile, Chile

Abstract. We report on recent improvements of the Atacama Pathfinder Experiment Control System (APECS) to cope with the ever increasing data rates and volumes. Also the very wide bandwidths of current instruments required switching to vectorized atmospheric opacity corrections using parallelization to speed these computations up for the quasi-realtime online pipeline. We look ahead at the coming years of continued APEX operations.

1. Overview

APEX (Atacama Pathfinder EXperiment) is a 12m single dish submillimeter telescope at 5100m altitude near the ALMA site on the Chajnantor plateau in Chile. The APEX Control System (APECS) provides telescope control, instrument configuration, raw data acquisition and data calibration which is handling observing sequences (e.g. on/off) and instrumental or atmospheric corrections. It also implements automatic observation and device parameter logging. The user interface is based on Python and allows for efficient scripted observations.

Due to the generic interfaces, APECS has been able to accommodate all facility and PI instruments during the past 15 years. In recent time many improvements were made to handle the ever increasing data rates and volumes. New calibration schemes can cope with the very wide bandwidths of current and future instruments. APECS was also adapted to use the new wobbler and hexapod of the APEX-II telescope hardware upgrade.

Future developments will address porting the software to Python 3 and migrating the real-time computer to a modern platform.

2. APECS Design

APECS^1 (Muders et al. 2006) is distributed across a number of servers that communicate with each other using the middleware provided by the ALMA Common Software

1APECS Manual (https://www.mpifr-bonn.mpg.de/technology/submm/apecs_manual_latest) 1

(ACS, Chiozzi & Šekoranja (2013)). ACS implements an object oriented component model with automatic parameter monitoring, logging and alarm services, and communication channels. ACS is based on the Common Object Request Broker Architecture (CORBA^2). Figure 1 shows the overall APECS design.

APECS defines generic interface classes for frontends (heterodyne & continuum), backends (spectrometers & total power recorders) and auxiliary devices such as Intermediate Frequency Processors (IFs). These interfaces allow adding new instruments very easily since the actual observing software does not have to be modified. The common interfaces are geared toward the astronomy rather than the technical domain.

Figure 1. APECS design with major components and connections.

Communication to the hardware controllers uses text commands according to the UDP SCPI protocol. This facilitates mapping the APECS object oriented interfaces to even very small micro controller based systems.

In APECS the "Observing Engine" uses a scan description object to configure telescope and instruments as required and to start and stop data taking and calibration. The observer sets up the scans using a Python shell with special commands. A remote control mode allows interfacing APECS to the VLBI field system e.g. for EHT observations.

3. Large Data Handling

The amount of data produced by APEX instruments has increased exponentially over time. In 2019 the maximum data rate was of the order 35 MB/s and a total of about 70

2https://www.corba.org

APEX Control System (APECS) 3

TB of raw and calibrated data were accumulated. The next generation of frontends and backends will push these limits further up.

The original APECS setup was based on 32 bit operating systems which impose a memory limit of 3 GB per process. The old numerical library used in Python ("Numeric") had an even lower limit of 2 GB per array variable. As a consequence, some observing modes like fast On-The-Fly mapping had to be restricted in size and duration to be able to calibrate the data. The switch to 64 bit systems was thus urgently needed.

The porting affected all software modules and took place over a period of more than a year. In addition to general 32 to 64 bit conversions, the numerical library had to be updated to "numpy" in the most important applications like the Calibrator and part of the Multi-Beam FITS (MBFITS^3) Writer. The new system APECS 4.0 was deployed during the 2018/19 shutdown time. Apart from removing the memory limitations, the switch to "numpy" also provided a significant speed-up of the online calibration. In 2020 the remainder of applications was ported to "numpy" in APECS 4.1.

4. Parallelized Data Writing

The MBFITS Writer used to be a multi-threaded Python application. The Python threading model is limited by the so called "Global Interpreter Lock" (GIL) which couples the threads to some extent. For data rates beyond 20 MB/s the MBFITS Writer reached the maximum load per process and started losing data. We therefore needed to develop a multi-process parallelized version. It decouples the TCP data receiver into a separate process. We tested this setup with a 10 Gbit network and were able to handle spectral backend data rates up to about 300 MB/s.

Figure 2. MBFITS Writer design and performance improvements.

5. Vectorized Opacities Calibration

With ever increasing frontend and backend bandwidths we have reached the point were the simple scalar opacity calibration is no longer adequate. In order to compute vectorized ATM solutions, the APEX Calibrator^4 code had to be parallelized using the Python

3MBFITS Format Definition (https://www.mpifr-bonn.mpg.de/technology/submm/mbfits_latest)

4APEX Calibrator Manual (https://www.mpifr-bonn.mpg.de/technology/submm/calibrator_manual_latest)

"multi-processing" library. The online calibration now calculates one opacity per MHz in the spectrum. The vector opacities (signal and image band) are also written to the CLASS file.

Recently another limitation in calibrating data of the B cabin receivers became obvious. The calibration unit provides a corrected T_{cold} value that varies sinusoidally with frequency. Up until 2019 the Calibrator assumed a single T_{cold} value per 4 GHz spectrum. This led to jumps between the basebands in T_{RX}, T_{cal} and the spectra. The new Calibrator of APECS 4.1, which was deployed in January 2020, now interpolates the T_{cold} values across a baseband and provides much improved calibrations (see figure 3).

Figure 3. Vectorized T_{cold} calibration avoids jumps between the IF basebands.

6. Future Developments

APECS is now more than 15 years old. While ACS and Linux updates allowed running the system on modern hardware, some of the technologies and software packages like Python 2 are now aging significantly. In order to be able to operate APEX for the coming years, we will work on upgrading these items. For next generation instruments APECS will need to be further enhanced to provide the proper data handling and calibration. This will also involve improving the MBFITS raw data format to speed up data access for the monitor tables.

References

Chiozzi, G., & Šekoranja, M. 2013, ACS: ALMA Common Software. 1302.003 Muders, D., Hafok, H., Wyrowski, F., Polehampton, E., Belloche, A., König, C., Schaaf, R., Schuller, F., Hatchell, J., & van der Tak, F. 2006, A&A, 454, L25. astro-ph/0605128