arXiv:2008.08362v2 [astro-ph.SR] 20 Aug 2020

Astronomy & Astrophysics manuscript no. arxiv_ © ESO 2020 August 22, 2020

First apsidal motion and light curve analysis of 162 eccentric eclipsing binaries from LMC

Zasche, P.^1, Wolf, M.^1, Kučáková, H.^{1, 2, 3}, Kára, J.^1, Merc, J.^{1, 4}, Zejda, M.^5, Skarka, M.^{5, 2}, Janík, J.^5, Kurfürst, P.^5.

1 Astronomical Institute, Charles University, Faculty of Mathematics and Physics, CZ-180 00, Praha 8, V Holešovičkách 2, Czech Republic 2 Astronomical Institute, Academy of Sciences, Fričova 298, CZ-251 65, Ondřejov, Czech Republic 3 Research Centre for Theoretical Physics and Astrophysics, Institute of Physics, Silesian University in Opava, Bezručovo nám. 13, CZ-746 01, Opava, Czech Republic 4 Institute of Physics, Faculty of Science, P. J. Šafárik University, Park Angelinum 9, 040 01 Košice, Slovakia 5 Department of Theoretical Physics and Astrophysics, Masaryk University, Kotlářská 2, CZ-611 37, Brno, Czech Republic

Received August 22, 2020; accepted ???

ABSTRACT

We present an extensive study of 162 early-type binary systems located in the LMC galaxy that show apsidal motion and have never been studied before. For the sample systems, we performed light curve and apsidal motion modelling for the first time. These systems have a median orbital period of 2.2 days and typical periods of the apsidal motion were derived to be of the order of decades. We identified two record-breaking systems. The first, OGLE LMC-ECL-22613, shows the shortest known apsidal motion period among systems with main sequence components (6.6 years); it contains a third component with an orbital period of 23 years. The second, OGLE LMC-ECL-17226, is an eccentric system with the shortest known orbital period (0.9879 days) and with quite fast apsidal motion period (11 years). Among the studied systems, 36 new triple-star candidates were identified based on the additional period variations. This represents more than 20 % of all studied systems, which is in agreement with the statistics of multiples in our Galaxy. However, the fraction should only be considered as a lower limit of these early-type stars in the LMC because of our method of detection, data coverage, and limited precision of individual times of eclipses.

Key words. stars: binaries: eclipsing – stars: fundamental parameters – stars: early-type – Magellanic Clouds

1. Introduction

The use of eclipsing binaries (EBs) for the precise derivation of the physical parameters of their components, such as masses and radii, still represents the most powerful method for deriving these quantities (see e.g. Southworth 2012). And thanks to these parameters we are able to improve and calibrate the existing models of stellar structure and evolution (Torres et al. 2010). We can also use the EBs as independent distance indicators, even outside of our Galaxy (e.g. Hilditch et al. 2005, or Vilardell et al. 2010).

Moreover, the eccentric EBs with detectable apsidal motion are important objects for studies of the internal structure constants and also to test the general relativity (Claret & Giménez 1993). For the systems, where the presence of an additional third body was detected, the more interesting dynamical interactions were also studied by Borkovits et al. (2015), among others. A large compilation of 623 galactic eccentric EBs was presented by Kim et al. (2018). The authors showed that about 5% of the systems they analysed also have a third unseen component (only based on eclipse timing variations, hereafter ETV). Finally, the effects like orbital circularisation (Zahn 2008) can also be studied by means of distribution of systems in the periodeccentricity diagram (see e.g. Kiminki & Kobulnicky 2012, or Meibom & Mathieu 2005).

Send offprint requests to: Petr Zasche, e-mail: zasche@sirrah.troja.mff.cuni.cz

Table 1. Compilation of papers studying LMC/SMC eccentric binaries.

Paper Field Number of systems

Zasche & Wolf (2013) LMC 5 Zasche et al. (2014) SMC 18 Zasche et al. (2015) LMC 13 Hong et al. (2015) SMC 27 Hong et al. (2016) SMC 90 Hong et al. (2019) LMC 3 Zasche & Wolf (2019) SMC 21 Our present study LMC 162

Several similar studies were published on this topic, focusing on the eccentric EBs in the LMC and SMC and yielding the apsidal motion parameters, but the present study is the most extensive one. The studies that use a similar method of analysing the photometry and yield the apsidal motion, and that contain three or more systems from the LMC and/or SMC, are summarised in Table 1.

2. Method of analysis

The selection of potential apsidal motion systems was a byproduct of our analysis of the whole LMC catalogue of EBs scanned for doubly eclipsing systems. We identified several hundreds of prospective eccentric systems for a more detailed analysis, but

Article number, page 1 of 25 only a small part of them were found to fit our criteria. With these limitations we mainly mean the apsidal motion period, which has to be shorter than 200 years (principal limit due to a typical data coverage, see below). This was the strictest criterion because a large portion of the systems show apsidal motion but with very long periods. Other criteria were the data coverage of the light curve (LC) and its photometric amplitude (depth of minima), but also good coverage of the apsidal motion in the O − C diagram, where the apsidal motion should be unambiguously detectable.

For our whole analysis we only used the photometric data. Databases like OGLE and MACHO were used when available, while for some systems new photometry from the Danish 1.54 m telescope (hereafter DK154) was also obtained^1. MACHO data (Alcock et al. 1997) cover the period 1992-2000, while the OGLE experiment (Udalski et al. 1992) was run in several parts: OGLE II in 1997-2000, OGLE III 2001-2009, and OGLE IV 2010-2014 for both Magellanic Clouds. The Photometric Data Retriever PDR (Zejda et al. 2019) was used for some systems to obtain the data.

The LC analysis using the PHOEBE 0.32svn code (Prša & Zwitter 2005) (which is based on the Wilson-Devinney algorithm Wilson & Devinney 1971) was routinely used for the analysis of all systems in our sample. However, when there was no spectroscopy, several assumptions had to be made: the mass ratio was fixed at q = 1.0, and the coefficients of albedo A, limbdarkening x, and gravity brightening g were kept fixed at their suggested values for hot stars. The quality of LCs does not usually allow us to also fit these second-order parameters.

A necessary input parameter is the primary temperature, which was estimated from the de-reddened photometric index (B − V)_0, which was derived following the procedure by Johnson (1958) using the values of photometric indices (B − V) and (U − B). The use of this method is substantiated because we deal here only with hot stars (of spectral types O-B-A), for which this presented (B − V)_0 transformation works. These values are given below in Tables A.1 and A.2. The primary temperature was derived from the (B − V)_0 photometric index using the assumption of main-sequence components and the tables by Pecaut & Mamajek (2013) and its later updates available online^2.

This procedure of T_1 estimation was used for majority of stars, but for 27 systems from our sample this resulted in rather dubious results. From these 27 systems, 19 systems were found with very low values of their indices (B − V)_0 < −0.31. Normal O-type stars should have the index in the range -0.32 to -0.31, but here we deal with almost all systems having much lower unrealistic values of this photometric index. Therefore, we decided to skip this colour information completely. Moreover, four systems have unavailable indices from Massey (2002) and Zaritsky et al. (2002); two systems have unrealistically high values of (B − V)_0 > 0; and finally two systems have values of their (B − V)_0 indices that are too different from those of Massey (2002) and Zaritsky et al. (2002). For these 27 systems we only roughly estimated their effective temperatures from their apparent magnitudes (and this magnitude-temperature relation was constructed using the other systems with realistic (B − V)_0 values). These stars are flagged in Tables A.1 and A.2 with asterisks. According to this temperature estimation it seems that all of the stars have effective temperatures below 32000 K, hence none of our stars is an O-type star.

1 Also available online via CDS.

2 www.pas.rochester.edu/∼emamajek/EEM_dwarf_UBVIJHK_colors_Teff.txt

From the complete LC analysis, we constructed an LC template, which was later used to derive the times of eclipses via our AFP method (see Zasche et al. 2014). For the sake of brevity, all the figures of the LCs given here were plotted during a shorter time interval to avoid phase smearing due to change of argument of periastron ω (and using mostly only OGLE III data in the I filter).

At this point it would be useful to explain our method step by step. First, we only roughly estimated the orbital period and the eccentricity. With this assumption, we made the LC template and performed a preliminary period analysis resulting in better estimation of the true eccentricity and the period. With these values of eccentricity and period, we constructed a better LC fit. With the new LC template we were able to perform better apsidal motion analysis. With this iterative procedure we were able to get the final solution, which is the one presented in Tables A.3 and A.4. It should also be mentioned that for the LC analysis we used the photometric data phased only for some shorter time interval (typically one or two OGLE seasons only, i.e. 1 or 2 years) to eliminate the effect of apsidal motion causing the change of duration and depth of the LC for the template. For systems where the apsidal motion is fast, we constructed several such templates and used them separately for certain time intervals of our photometric data. The rate of apsidal motion was derived from the eclipse times, which we found is better than that derived from the LC fits. The apsidal motion analysis uses the standard technique of least-squares minimisation, as introduced by Gimenez & Garcia-Pelayo (1983) and Giménez & Bastero (1995), among others.

3. Results

Due to the very large number of individual systems, we cannot focus on each of the stars analysed in our sample. We would thus like to focus only on the most interesting results and systems that deserve our attention, and to encourage future observers and investigators to consider these particular systems.

All of our results are divided into several parts. First, the classical LC modelling and its results are given below in Tables A.3 and A.4 and the plots in Figs. 1 – 6. Second, the apsidal motion parameters are given in Tables A.3 and A.4, while the fits can be seen in Figs. 7 – 12. These figures show the apparent period variations of the particular stars via the eclipse timing variation together with the fits. Finally, the systems where some additional variations in the times of eclipses were detected and showed unambiguous period variability were additionally fitted assuming the light-time effect hypothesis (Mayer 1990). This hypothesis assumes a third body orbiting the inner eccentric eclipsing binary around a common barycentre. However, the potential detectability of any such body is highly dependent on the third body’s mass, its orbit, orientation, period, etc. Therefore, the number of systems detected with our method should be considered a lower limit, and any definite conclusions about the multiplicity fraction are still rather speculative because the incompleteness fraction would be rather high (see discussion in Section 5). Altogether 36 such systems were found for which the residuals after the apsidal motion fits were successfully fitted with the light-time effect hypothesis. All of these are shown in Fig. 13, while five parameters of these fits are given in Table A.5.

At this point it would be useful to recall some basic equations of the light-time effect and also our analysis approach. The observed deviation of individual minima in the O − C diagram

Article number, page 2 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 1. Plot of the light curves, part 1.

Article number, page 3 of 25

Fig. 2. Plot of the light curves, part 2.

Article number, page 4 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 3. Plot of the light curves, part 3.

Article number, page 5 of 25

Fig. 4. Plot of the light curves, part 4.

Article number, page 6 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 5. Plot of the light curves, part 5.

Article number, page 7 of 25

Fig. 6. Plot of the light curves, part 6.

Article number, page 8 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 7. Plot of the O − C diagrams, part 1. Final fits of the apsidal motion are plotted as black and blue curves (for primary and secondary minima), while the individual points represent the times of eclipses. The larger the symbol, the higher the weight (which was assigned according to its uncertainty). New observations with DK154 are shown in red. In cases where an additional third body was found, the final fit is plotted (solid lines) together with only the apsidal motion fits (dashed lines). Article number, page 9 of 25

Fig. 8. Plot of the O − C diagrams, part 2. Article number, page 10 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 9. Plot of the O − C diagrams, part 3. Article number, page 11 of 25

Fig. 10. Plot of the O − C diagrams, part 4. Article number, page 12 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 11. Plot of the O − C diagrams, part 5. Article number, page 13 of 25

Fig. 12. Plot of the O − C diagrams, part 6. Article number, page 14 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

can be described by

(O − C) = JD_i − HJD_0 − P · E − (O − C)_{LT E} − (O − C)_{AM}, (1)

where the particular minimum JD_i at epoch E is being compared with its theoretical prediction also taking into account the lighttime effect term (O − C)_{LT E} and the apsidal motion term (O − C)_{AM} . The light-time effect can be expressed as

(O−C)_{LT E} = A � 1 − e^2_3 cos^2 ω_3 � � � (1 − e^2_3) sin(ν + ω_3)

1 + e_3 cos ν

+ e_3 sin ω_3 � � � , (2) where A is the semi-amplitude, e_3 is the eccentricity of the third body orbit, ω_3 its argument of periastron, and ν its true anomaly. The mass function of this third-body orbit can be expressed as

f (m_3) =

(m_3 sin i)^3 (m_1 + m_2 + m_3)^2 = 1 P^2_3 · � � � � � 173.15 · A � 1 − e^2_3 cos^2 ω_3

� � � � � 3 , (3)

where i stands for the inclination between the mutual orbit and the plane of the sky, and m_1, m_2, m_3 are the masses of the primary, secondary, and tertiary components, respectively. For the second expression it is necessary to input the units of the outer period P_3 in years and the semi-amplitude A in days. With this mass function we can at least make some preliminary estimates about the third body’s mass. However, for some more reliable derivation precise masses and also the inclination are needed. We also note that in a triple system, there is in principle a much more complicated influence of the third perturbing body on the apsidal motion of the eccentric inner pair (see e.g. Borkovits et al. 2015, or Borkovits et al. 2019) in addition to the classical tidal and the relativistic contributions.

The total ETV component due to the action of a third body is composed in principle of several contributions. Here we assume only the most dominant one, the classical geometrical light-time effect term. However, in general there are also other dynamical terms. In principle, these effects can be large or even dominate over the classical light-time effect. In our sample, where we deal with quite short orbital periods of the inner pairs and quite long periods of the outer bodies, we can state that for the majority of systems the light-time effect is certainly the dominant one. In Rappaport et al. (2013) a physical delay due to the third body is introduced, which has its amplitude proportional to the ratio (P^2/P_3). Hence, for majority of our systems third-body period that is too long makes the amplitude of this physical delay too small. On the other hand, there are also other longer-period perturbations (see e.g. Rappaport et al. 2013, Section 4.2), which have typical periods of the order of P^2_3/P, and that cause for example the orbital precession and change in the eclipse depths. In our sample the timescales of the longer-period perturbations are typically longer than a human lifetime. Both these ratios P^2/P_3, and P^2_3/P are given in the last columns of Table A.5.

The question arises of whether these systems show some concordance with the systems with a detected third light contribution. However, we note that this link is not so unambiguous. For some of the potential triple systems the third bodies should have only negligibly low luminosities. On the other hand, for some systems, the detection of a third light could also be explained by an unbound star along the same line of sight. This situation is nothing novel in these very dense stellar fields in the LMC. However, mostly the detection of the light-time effect agrees with the non-zero value of the third light for a particular system. A typical example would be OGLE LMC-ECL-15664, which was identified as a system showing the largest mass function, as well as the largest value of the third light in the LC solution.

The quality of the apsidal motion fits in Figs. 7 – 12 is mostly reasonable, but strongly depends on the value of eccentricity of the orbit (i.e. the amplitude of apsidal motion in the O − C diagram), and its apsidal motion rate (i.e. the period of apsidal advance, because longer periods only have small parts covered with data). The quality of the individual times of eclipses is comparable for different systems (usually of the order of 0.001- 0.0001 d), only those with shallow eclipses and/or longer orbital periods have less precise times of eclipse.

The most interesting definitely seem to be those systems with third bodies and with a very rapid apsidal motion. Stars that have very fast apsidal motion usually have very short orbital periods. Among these, there was discovered a record-breaking system, OGLE LMC-ECL-17226, which has an eccentric orbit despite its short period (P = 0.9879314 day). This is, as far as we know, the shortest eccentric main sequence star ever discovered (the previous record of about 1.016 days belongs to the star V456 Oph located in our Galaxy; see Wolf et al. 2017). The apsidal motion of OGLE LMC-ECL-17226 is also rather fast (about 12 yr), while its eccentricity is very low (about 0.037).

Among other stars (in addition to OGLE LMC-ECL-17226), additional systems having a very rapid apsidal motion of about ten years or even faster were also found: OGLE LMC-ECL- 06837 (U = 9.9 yr), #17774 (U = 7.2 yr), -22613 (U = 6.6 yr), -23298 (U = 12.2 yr), -25047 (U = 10.8 yr). To date, the system with the fastest apsidal advance in our Galaxy is V490 Cyg (Zasche, & Wolf 2011) having U = 18.6 yr, while out of our Galaxy, it is the star from the SMC named OGLE SMC-ECL- 2194 having U = 7.1 yr (Hong et al. 2015). For the list of all our analysed systems and their results, see Tables A.3 and A.4. It is important to note that the ephemerides given in Tables A.3 and A.4 are not always suitable for planning future observations. They represent only the value O − C = 0 in the diagrams in Figs. 7-12. Hence for eclipse predictions, corrections are needed, especially in cases where the eccentricity is high and the apsidal motion amplitude significant.

Another interesting group of stars is the one where the thirdbody contribution to ETV caused by the light-time effect is even larger than the contribution from the apsidal motion itself. These are: OGLE LMC-ECL-10302, -16320, -17267, -20860, and - 22613. The dominance of the light-time effect can be caused by two different phenomena: a very massive third body causing large amplitude of ETV, or in some systems only very low eccentricity of the inner orbit. In our cases shown here, both of these explanations play a role together.

4. Properties of the sample

First we look at the distribution of the orbital periods of the stars in our sample. Obviously, these are influenced by a strong selection effect, mainly due to our method of selection. Only those systems having an adequately short orbital period (usually P ≲ 3d) can be studied using our methods (and having enough data for such an analysis). For this reason the plot in Fig. 14 shows a vast majority of systems from 1 to 3 days. Shorter-period systems are usually circular, while the longerperiod ones usually have too slow apsidal motion to show a significant change over two decades, which is the typical time span of our data.

Article number, page 15 of 25

Another diagram in Fig. 15 shows how the apsidal motion period depends on the orbital period of the binary. Longerperiod systems usually also have slower apsidal motion, while the fastest apsidal motion should preferably be detected for shorter orbital periods.

In Fig. 16 we show the distribution of the relative radii resulting from our light curve analysis (for the primary and secondary components). It is clearly seen that preferentially those systems having relative radii between 0.15 and 0.25 were usually studied. This is again a selection effect of our method. Systems having too distant components usually have too slow apsidal motion (> 200 yr) to be detectable with our approach, and systems closer to each other were already circularised.

In Fig. 17 we plotted the eccentricity versus orbital period. For comparison we also added other compilations and apsidal motion studies from LMC/SMC from Table 1, and the apsidal motion systems published in the catalogue of Kim et al. (2018), who studied galactic systems. It is clearly seen that our present sample incorporates mainly the shorter-period systems (mostly below 4 days), but the overall tendency to detect the higher eccentricities only with longer periods is obvious. Hence, the circularisation in more compact systems is also much faster in the LMC galaxy (see e.g. Tassoul 1988).

5. Discussion and conclusions

Our new analysis of 162 eccentric eclipsing binaries in LMC presents the largest sample studied to date in one paper (both of the LC and apsidal motion) and provide us with unique material for comparison with other results.

Because we have limited information about the stars, and no spectroscopy for these targets, the inferred parameters are only relative ones (like the relative radii), and the masses are completely unknown. The uncertainties of masses inferred from the photometric indices are too large, hence they cannot easily be used to derive the internal structure constants. Only future spectroscopic monitoring would help us in this aspect.

The ETVs due to the light-time effect term are usually rather small, which also yielded small mass function values (with only a few exceptions). The other ETV effects are negligible, or would be very slow (see the last columns of Table A.5). Hence, for instance we cannot hope to find any dynamical indication of these third bodies, for example via changing the inclination angle through eclipse depth variations (only one system has the typical period of this nodal regression below 1000 years).

On the other hand, the presented study of residuals and fitting of the light-time effect (see Figs. 13) is only one part of the whole sample. Other systems were found to show additional variation, but they are still not well-covered, have too long periods, or too low amplitudes. For these reasons the variation is visible, but for a proper analysis we need more data spanning a longer time interval or better data to reduce the scatter. This is why we only briefly mention these systems in Fig. 18, where the residuals after the subtraction of the apsidal motion are plotted, but no light-time effect fit is given yet. This should encourage observers to collect new data for these systems to prove or reject the hypothesis of the third body.

If we take into account the proved 36 systems with the lighttime effect fits in Figs. 13 and add the 19 suspected ones from Fig. 18, then the total fraction of potential triples in our sample grows from 20% to about 34%. We are aware that our preprocessing and selection of suitable systems for this analysis can provide some bias towards these potential triples. However, as was already stated in Sect. 2, for most of the discarded systems the criterion was the slow rate of apsidal motion. This is probably not directly connected with the multiplicity, hence its role should be small. However, what should play a role is that the stars with very small photometric amplitude (shallow eclipses) were also neglected. These systems might also be triples because the high value of the third light makes the eclipses shallower. Hence, we would probably miss these potential triples rather than overestimate their fraction in the LMC eclipsing sample. Such a large fraction of potential triples is several times more than what was found in their sample by Kim et al. (2018). However, they studied the stars in our Galaxy, where the field stars are of much later spectral type; hence, the multiplicity fraction is much lower (Duchêne & Kraus 2013). Therefore, our number should only be compared with the suggested number of multiples in the early-type population in LMC. According to Duchêne & Kraus (2013), the probability of a star to be a multiple for these massive stars should be very high and reach almost 100% for the O and B stars. Hence, our rough estimation of 1/3 should be considered a lower limit due to the methodology incompleteness limitations (e.g. long periods and short periods cannot be detected with our method; masses and inclinations play a crucial role for a light-time effect to emerge in our residuals).

Acknowledgements. We are thankful to an anonymous referee for the critical suggestions greatly improving the quality of the whole manuscript. This work was supported by the grant MSMT INGO II LG15010, grant GA ČR 18-05665S, and grant Primus/SCI/17. Marek Skarka acknowledges the OP VVV project Postdoc@MUNI (No. CZ.02.2.69/0.0/0.0/16027/0008360). We would like to thank J.Liška, K.Hornoch, L.Pilarčík, and J.Vraštil for obtaining some of the photometric data. We also do thank the OGLE and MACHO teams for making all of the observations easily public available. We are also grateful to the ESO team at the La Silla Observatory for their help in maintaining and operating the Danish telescope. This research has made use of the SIMBAD and VIZIER databases, operated at CDS, Strasbourg, France and of NASA Astrophysics Data System Bibliographic Services.

References

Alcock, C., Allsman, R. A., Alves, D., et al. 1997, ApJ, 486, 697 Borkovits, T., Rappaport, S., Hajdu, T., et al. 2015, MNRAS, 448, 946 Borkovits, T., Forgács-Dajka, E., & Rappaport, S. A. 2019, EAS Publications Series, 99 Claret, A., & Giménez, A. 1993, A&A, 277, 487 Duchêne, G., & Kraus, A. 2013, ARA&A, 51, 269 Gimenez, A., & Garcia-Pelayo, J. M. 1983, Ap&SS, 92, 203 Giménez, A., & Bastero, M. 1995, Ap&SS, 226, 99 Graczyk, D., Soszyński, I., Poleski, R., et al. 2011, AcA, 61, 103 Hilditch, R. W., Howarth, I. D., & Harries, T. J. 2005, MNRAS, 357, 304 Hong, K., Kim, S.-L., Lee, J. W., et al. 2015, AJ, 150, 1 Hong, K., Lee, J. W., Kim, S.-L., Koo, J.-R., & Lee, C.-U. 2016, MNRAS, 460, 650 Hong, K., Lee, J. W., Kim, S.-L., et al. 2019, AJ, 158, 185 Johnson, H. L. 1958, Lowell Observatory Bulletin, 4, 37 Kim, C.-H., Kreiner, J. M., Zakrzewski, B., et al. 2018, ApJS, 235, 41 Kiminki, D. C., & Kobulnicky, H. A. 2012, ApJ, 751, 4 Massey, P. 2002, ApJS, 141, 81 Mayer, P. 1990, BAICz, 41, 231 Meibom, S., & Mathieu, R. D. 2005, ApJ, 620, 970 Pawlak, M., Soszyński, I., Udalski, A., et al. 2016, Acta Astron., 66, 421 Pecaut, M. J., & Mamajek, E. E. 2013, ApJS, 208, 9 Prša, A., & Zwitter, T. 2005, ApJ, 628, 426 Rappaport, S., Deck, K., Levine, A., et al. 2013, ApJ, 768, 33 Southworth, J. 2012, Orbital Couples: Pas de Deux in the Solar System and the Milky Way, 51 Tassoul, J.-L. 1988, ApJ, 324, L71 Torres, G., Andersen, J., & Giménez, A. 2010, A&A Rev., 18, 67 Udalski, A., Szymanski, M., Kaluzny, J., Kubiak, M., & Mateo, M. 1992, Acta Astron., 42, 253 Vilardell, F., Ribas, I., Jordi, C., Fitzpatrick, E. L., & Guinan, E. F. 2010, A&A, 509, A70 Wilson, R. E., & Devinney, E. J. 1971, ApJ, 166, 605

Article number, page 16 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Wolf, M., Zasche, P., Kučáková, H., et al. 2017, Acta Astron., 67, 257 Zahn, J.-P. 2008, EAS Publications Series, 29, 67 Zaritsky, D., Harris, J., Thompson, I. B., Grebel, E. K., & Massey, P. 2002, AJ, 123, 855 Zasche, P., & Wolf, M. 2011, A&A, 527, A43 Zasche, P., & Wolf, M. 2013, A&A, 558, A51 Zasche, P., Wolf, M., Vraštil, J., et al. 2014, A&A, 572, A71 Zasche, P., Wolf, M., Vraštil, J., & Pilarčík, L. 2015, AJ, 150, 183 Zasche, P., & Wolf, M. 2019, AJ, 157, 87 Zejda, M., Skýba, O., Krajčovič, M., Gajdoš, P., & Fedurco, M. 2019, CoSka, 49, 132

Appendix A: Appendix

Article number, page 17 of 25

Table A.1. Relevant information for the analysed systems.

S y s t e m n a m e RA DE V^A_{max} (B − V)^B (B − V)^B_0 (B − V)^C (B − V)^C_0 OGLE III OGLE II MACHO [mag] [mag] [mag] [mag] [mag]

OGLE LMC-ECL-00127 04:37:08.25 -69:06:55.1 17.60 – – -0.021 -0.097 OGLE LMC-ECL-00442 04:43:14.95 -70:33:58.6 15.45 – – -0.116 -0.295 OGLE LMC-ECL-00483 04:43:38.64 -69:43:34.6 18.58 – – 0.153 -0.153 OGLE LMC-ECL-00510 04:43:51.87 -68:49:32.0 17.56 – – -0.458 0.139 OGLE LMC-ECL-00527 04:44:02.05 -67:20:33.2 18.07 – – -0.308 0.151 OGLE LMC-ECL-00648 04:45:18.51 -69:43:02.7 17.75 – – 0.001 -0.160 OGLE LMC-ECL-00652 04:45:23.73 -69:09:55.7 16.61 -0.05 -0.217 -0.070 -0.181 OGLE LMC-ECL-00666 04:45:35.21 -68:29:14.3 17.38 – – 0.061 -0.299 OGLE LMC-ECL-00737 04:46:17.60 -67:53:06.5 17.05 – – -0.052 -0.220 OGLE LMC-ECL-00868 44.1138.118 04:47:23.92 -69:38:28.9 17.92 0.19 -0.073 0.007 -0.139 OGLE LMC-ECL-00872 45.1157.218 04:47:25.72 -68:25:12.4 18.54 – – 0.135 -0.189 OGLE LMC-ECL-00929 04:47:52.41 -66:52:28.8 18.47 – – -0.033 0.151 OGLE LMC-ECL-00955 04:48:01.92 -70:22:44.3 18.61 – – 0.126 -0.131 OGLE LMC-ECL-01445 44.1626.46 04:50:35.32 -69:25:20.2 16.82 0.13 -0.108 -0.014 -0.229 OGLE LMC-ECL-02912^∗ 04:55:14.81 -68:56:18.5 17.82 -0.26 0.034 0.267 -0.154 OGLE LMC-ECL-02943 18.2360.151 04:55:20.88 -68:51:10.1 17.62 – – 0.031 -0.066 OGLE LMC-ECL-04957 24.3223.52 05:00:32.62 -67:48:17.1 18.08 – – 0.251 -0.026 OGLE LMC-ECL-05345 SC15 152403 18.3449.3635 05:01:40.18 -68:51:05.5 15.38 -0.06 -0.271 -0.040 -0.274 OGLE LMC-ECL-06837 SC13 66307 19.4063.100 05:05:07.12 -68:16:22.9 17.17 – – 0.056 -0.231 OGLE LMC-ECL-07578 SC13 183860 19.4300.349 05:06:43.25 -68:36:11.4 15.76 – – -0.072 -0.220 OGLE LMC-ECL-07585^∗ 25.4321.184 05:06:44.73 -67:12:41.8 18.40 – – 0.502 -0.340 OGLE LMC-ECL-07641 SC13 194100 19.4302.319 05:06:51.94 -68:25:46.5 14.22 – – -0.184 -0.195 OGLE LMC-ECL-07838 52.4447.1225 05:07:17.83 -66:50:37.6 16.81 – – 0.030 -0.174 OGLE LMC-ECL-08311 SC11 103746 1.4530.37 05:08:27.80 -69:25:28.7 15.82 0.15 -0.346 -0.111 -0.238 OGLE LMC-ECL-08397^∗ SC11 162262 05:08:38.89 -68:45:45.7 14.69 – – 0.085 -0.531 OGLE LMC-ECL-08439 19.4663.3317 05:08:44.93 -68:34:26.3 16.97 – – 0.045 -0.170 OGLE LMC-ECL-08752 SC11 331573 79.4779.34 05:09:29.21 -68:55:02.6 14.92 -0.07 -0.302 -0.238 -0.117 OGLE LMC-ECL-08859 20.4795.146 05:09:45.57 -67:51:02.8 17.74 – – -0.019 -0.019 OGLE LMC-ECL-09186 SC10 16968 5.4894.3904 05:10:28.64 -69:20:47.9 15.73 0.18 -0.257 -0.012 -0.229 OGLE LMC-ECL-10302 05:13:25.33 -69:34:13.9 16.18 0.19 -0.259 – – OGLE LMC-ECL-10377 SC9 121731 5.5377.4656 05:13:36.22 -69:22:41.4 16.25 0.32 -0.382 -0.004 -0.216 OGLE LMC-ECL-10446 05:13:45.17 -67:19:47.8 16.07 – – -0.269 -0.001 OGLE LMC-ECL-10601 16.5523.48 05:14:08.60 -67:41:58.7 16.84 – – 0.000 -0.179 OGLE LMC-ECL-10672 05:14:18.68 -66:37:26.7 18.03 – – 0.019 -0.218 OGLE LMC-ECL-10867 05:14:49.59 -67:20:32.8 17.06 – – -0.029 -0.197 OGLE LMC-ECL-11183^∗ 05:15:33.20 -70:20:21.0 17.33 – – 0.840 -0.389 OGLE LMC-ECL-11320 05:15:51.42 -67:42:41.2 17.07 – – -0.036 -0.138 OGLE LMC-ECL-11351 SC8 168297 79.5746.319 05:15:57.02 -68:58:04.6 17.58 – – 0.178 -0.180 OGLE LMC-ECL-11374 79.5750.262 05:16:01.13 -68:45:31.9 18.35 – – 0.090 -0.104 OGLE LMC-ECL-11680 SC8 199230 05:16:50.17 -69:35:37.9 17.07 0.05 0.005 – – OGLE LMC-ECL-11854 SC8 312491 78.5981.322 05:17:15.40 -69:26:14.8 17.09 -0.28 -0.189 -0.082 -0.096 OGLE LMC-ECL-11929^∗ SC8 305721 78.5981.107 05:17:29.97 -69:27:58.5 15.83 -0.27 -0.168 -0.033 -0.097 OGLE LMC-ECL-12002 05:17:40.76 -67:59:47.1 16.76 – – 0.031 -0.218 OGLE LMC-ECL-12043 05:17:45.49 -67:53:06.5 18.29 – – 0.132 -0.142 OGLE LMC-ECL-12234^∗ SC7 150213 78.6100.606 05:18:12.60 -69:35:24.4 17.45 – – – – OGLE LMC-ECL-12323 05:18:25.01 -70:24:08.9 18.03 – – 0.274 -0.226 OGLE LMC-ECL-12504^∗ SC7 278663 05:18:48.41 -69:33:57.5 17.52 – – – – OGLE LMC-ECL-12513^∗ SC7 278743 78.6222.903 05:18:50.01 -69:33:30.3 17.74 0.38 -0.418 – – OGLE LMC-ECL-12687 SC7 287027 05:19:15.46 -69:30:58.2 17.25 – – 0.045 -0.042 OGLE LMC-ECL-12792 SC7 417231 78.6344.776 05:19:31.41 -69:26:59.9 18.33 – – -0.136 0.124 OGLE LMC-ECL-13039^∗ SC7 397930 78.6464.1043 05:20:07.88 -69:32:41.4 17.93 – – 0.473 -0.387 OGLE LMC-ECL-13198^∗ SC6 58359 78.6463.505 05:20:35.07 -69:34:37.8 17.30 – – – – OGLE LMC-ECL-13202 3.6484.101 05:20:35.79 -68:12:17.2 17.39 -0.14 -0.030 0.064 -0.215 OGLE LMC-ECL-13321 SC6 143503 05:20:52.65 -69:52:24.3 18.04 – – 0.407 -0.200 OGLE LMC-ECL-13407 3.6603.171 05:21:05.82 -68:20:10.4 17.62 0.560 -0.090 -0.011 -0.013 OGLE LMC-ECL-13452 16.6609.43 05:21:11.63 -67:55:34.6 16.53 – – -0.074 -0.243 OGLE LMC-ECL-13467 80.6591.25 05:21:14.51 -69:05:40.6 15.72 -0.11 -0.239 0.105 -0.277 OGLE LMC-ECL-13567 80.6712.1405 05:21:30.12 -69:07:15.8 18.04 -0.12 0.115 0.053 0.007 OGLE LMC-ECL-13601^∗ SC6 322535 78.6708.180 05:21:34.84 -69:25:34.6 16.70 – – 0.266 -0.371 OGLE LMC-ECL-13809^∗ 05:22:02.86 -67:58:46.6 16.93 – – 0.154 -0.370 OGLE LMC-ECL-13842 05:22:07.88 -67:48:56.2 16.22 – – -0.090 -0.275 OGLE LMC-ECL-13851 3.6841.1394 05:22:08.65 -68:37:15.4 16.97 0.15 -0.176 -0.183 -0.104 OGLE LMC-ECL-13902 05:22:14.88 -67:47:16.7 17.64 – – -0.096 -0.182 OGLE LMC-ECL-14013 05:22:28.93 -68:04:54.9 17.19 – – 0.090 -0.283 OGLE LMC-ECL-14159 80.6835.204 05:22:46.12 -69:00:50.6 17.45 0.43 -0.170 -0.087 -0.098 OGLE LMC-ECL-14462 SC5 124709 6.6940.6208 05:23:27.72 -70:02:53.3 15.97 – – -0.137 -0.215 OGLE LMC-ECL-15161 SC5 349685 77.7303.152 05:25:09.33 -70:04:22.6 16.41 – – 0.072 -0.119 OGLE LMC-ECL-15288 80.7316.43 05:25:29.32 -69:10:56.0 15.97 -0.10 -0.218 -0.067 -0.189 OGLE LMC-ECL-15386 80.7318.1393 05:25:45.38 -69:01:54.8 17.67 – – -0.091 -0.059 OGLE LMC-ECL-15441 SC4 220655 05:25:53.52 -69:30:49.5 17.62 – – 0.116 -0.133 OGLE LMC-ECL-15473 3.7443.37 05:25:57.49 -68:46:36.1 17.10 0.08 -0.099 0.155 -0.247 OGLE LMC-ECL-15496 SC4 177590 05:26:00.17 -69:51:15.4 18.11 – – -0.200 0.049 OGLE LMC-ECL-15664 80.7443.1746 05:26:21.14 -68:46:44.5 15.91 0.07 -0.273 0.024 -0.313 OGLE LMC-ECL-15764 SC4 281015 77.7547.1048 05:26:35.74 -69:55:54.6 18.03 – – 0.030 -0.059 OGLE LMC-ECL-15779 SC4 296152 77.7548.325 05:26:36.54 -69:51:25.4 16.74 – – -0.395 0.099 OGLE LMC-ECL-16178 05:27:23.88 -69:05:00.7 16.53 0.09 -0.268 -0.085 -0.151 OGLE LMC-ECL-16310 05:27:41.15 -69:16:20.3 15.57 -0.03 -0.298 -0.068 -0.122 OGLE LMC-ECL-16320^∗ 7.7658.56 05:27:42.23 -70:35:59.6 15.93 – – -0.086 -0.348 OGLE LMC-ECL-16414 05:27:53.17 -69:03:51.6 16.53 0.16 -0.189 -0.216 -0.073 OGLE LMC-ECL-16442 SC3 46420 77.7669.3224 05:27:56.24 -69:53:12.3 19.03 – – 0.127 -0.155 OGLE LMC-ECL-16625 05:28:18.80 -69:03:55.0 16.41 -0.15 -0.249 0.096 -0.178 OGLE LMC-ECL-16732 05:28:31.27 -69:13:40.7 16.10 0.13 -0.234 0.120 -0.260

Note: The full name from the OGLE II survey should be OGLE LMC-SCn nnnnnn. [A] Out-of-eclipse V magnitude based on OGLE database, see Graczyk et al. (2011) and Pawlak et al. (2016); [B] photometric index by Massey (2002); [C] photometric index by Zaritsky et al. (2002). An asterisk in the name of particular system flags that this system has dubious temperature T_1 as derived from its photometric index (B − V)_0. Therefore, for these stars their effective temperatures were only roughly estimated, see the text for details.

Article number, page 18 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Table A.2. Relevant information for the analysed systems - continuation.

S y s t e m n a m e RA DE V^A_{max} (B − V)^B (B − V)^B_0 (B − V)^C (B − V)^C_0 OGLE III OGLE II MACHO [mag] [mag] [mag] [mag] [mag]

OGLE LMC-ECL-16925 05:28:52.91 -70:20:52.6 17.05 – – 0.036 -0.256 OGLE LMC-ECL-16928 SC3 317490 05:28:53.03 -69:32:27.2 18.09 – – 0.062 -0.056 OGLE LMC-ECL-16983 SC3 329044 77.7917.602 05:29:00.17 -69:25:53.1 18.17 – – -0.005 -0.128 OGLE LMC-ECL-17030 SC3 317678 77.7916.397 05:29:06.00 -69:31:16.4 17.59 – – 0.040 -0.137 OGLE LMC-ECL-17042 82.7926.48 05:29:07.25 -68:53:02.3 16.47 -0.03 -0.212 -0.192 -0.005 OGLE LMC-ECL-17183 7.7903.453 05:29:23.15 -70:22:28.0 17.80 – – -0.004 -0.055 OGLE LMC-ECL-17198 05:29:24.63 -68:42:13.1 14.12 -0.17 -0.268 -0.048 -0.241 OGLE LMC-ECL-17223 05:29:28.97 -68:44:10.8 16.54 -0.26 -0.184 -0.114 -0.213 OGLE LMC-ECL-17226^∗ 05:29:29.33 -71:01:18.7 18.80 – – 0.612 -0.522 OGLE LMC-ECL-17236 05:29:30.94 -68:40:12.8 17.75 – – -0.194 -0.042 OGLE LMC-ECL-17267 82.8049.37 05:29:34.38 -68:42:33.3 15.89 -0.13 -0.257 -0.124 -0.283 OGLE LMC-ECL-17283 21.8008.68 05:29:37.25 -71:26:43.4 17.34 – – -0.011 -0.151 OGLE LMC-ECL-17299 SC3 402931 77.8034.941 05:29:39.38 -69:44:46.3 18.11 – – 0.006 -0.039 OGLE LMC-ECL-17406 05:29:51.43 -68:39:53.3 16.07 -0.17 -0.218 -0.084 -0.260 OGLE LMC-ECL-17498 7.8025.972 05:30:01.77 -70:21:22.1 17.91 – – -0.059 -0.167 OGLE LMC-ECL-17543 82.8047.152 05:30:07.32 -68:50:34.4 17.22 0.16 -0.115 -0.027 -0.149 OGLE LMC-ECL-17579 05:30:12.26 -68:30:32.6 15.78 0.03 -0.246 0.013 -0.235 OGLE LMC-ECL-17711 SC2 103719 77.8158.89 05:30:28.68 -69:30:03.7 16.57 -0.17 -0.212 -0.027 -0.262 OGLE LMC-ECL-17718 7.8140.136 05:30:29.24 -70:43:32.1 17.11 – – -0.084 -0.083 OGLE LMC-ECL-17774 05:30:35.11 -69:03:33.3 14.91 -0.06 -0.271 -0.100 -0.234 OGLE LMC-ECL-17777 82.8170.32 05:30:35.46 -68:42:45.5 16.36 0.01 -0.215 -0.026 -0.234 OGLE LMC-ECL-17800 SC2 214143 82.8160.2708 05:30:39.35 -69:23:57.1 16.97 – – -0.037 -0.186 OGLE LMC-ECL-17809 21.8126.151 05:30:40.46 -71:40:32.0 17.72 – – -0.032 -0.048 OGLE LMC-ECL-17923 4.8177.63 05:30:54.30 -68:16:17.4 17.48 0.16 -0.155 1.371 -0.494 OGLE LMC-ECL-18077 05:31:11.71 -71:04:21.2 18.02 – – 0.060 -0.085 OGLE LMC-ECL-18152 05:31:21.80 -69:11:15.6 16.15 0.16 -0.275 0.229 -0.306 OGLE LMC-ECL-18174 SC2 315183 77.8281.58 05:31:24.61 -69:25:28.1 16.96 -0.13 -0.075 0.051 -0.165 OGLE LMC-ECL-18316^∗ 05:31:43.49 -68:28:10.5 17.20 – – 0.408 -0.419 OGLE LMC-ECL-18355^∗ 05:31:47.85 -68:33:26.7 16.24 – – -0.938 0.318 OGLE LMC-ECL-18371 8.8424.131 05:31:49.93 -67:53:52.1 18.05 – – -0.002 -0.133 OGLE LMC-ECL-18408 05:31:54.55 -68:59:19.7 17.38 0.42 -0.061 0.578 -0.383 OGLE LMC-ECL-18500 SC2 351438 05:32:06.62 -70:04:56.5 17.97 – – 0.235 -0.137 OGLE LMC-ECL-18501^∗ 82.8407.1180 05:32:06.68 -69:04:34.5 18.00 – – 0.374 -0.337 OGLE LMC-ECL-18579 82.8404.209 05:32:16.49 -69:15:35.7 17.03 0.17 -0.138 0.010 -0.216 OGLE LMC-ECL-19095 05:33:26.76 -69:10:51.3 16.63 -0.03 -0.248 -0.069 -0.137 OGLE LMC-ECL-19294 82.8648.78 05:33:53.71 -69:09:02.8 16.89 0.54 -0.189 -0.023 -0.201 OGLE LMC-ECL-19577 SC1 335438 81.8760.105 05:34:32.08 -69:45:36.2 16.08 – – -0.081 -0.218 OGLE LMC-ECL-19583 14.8744.3528 05:34:33.06 -70:49:10.4 17.78 – – 0.046 -0.240 OGLE LMC-ECL-19624 8.8780.16 05:34:39.71 -68:21:55.5 15.94 -0.19 -0.280 -0.433 -0.153 OGLE LMC-ECL-19675 05:34:48.91 -68:19:46.7 17.13 -0.26 -0.105 -0.124 -0.177 OGLE LMC-ECL-19727^∗ 05:34:57.01 -69:15:41.6 18.11 – – 0.434 -0.455 OGLE LMC-ECL-19879 SC16 70662 81.8881.47 05:35:17.59 -69:43:18.8 15.02 – – 0.014 -0.296 OGLE LMC-ECL-20053 05:35:41.09 -68:58:57.9 16.10 0.07 -0.213 0.117 -0.237 OGLE LMC-ECL-20066 05:35:42.99 -69:14:10.4 17.24 – – 0.004 -0.176 OGLE LMC-ECL-20285 05:36:09.54 -68:55:27.4 16.29 – – -0.480 -0.012 OGLE LMC-ECL-20299 81.9005.17 05:36:10.74 -69:32:02.2 14.63 -0.08 -0.306 -0.019 -0.299 OGLE LMC-ECL-20384 82.9132.83 05:36:20.35 -69:06:15.7 16.57 0.10 -0.283 -0.061 -0.178 OGLE LMC-ECL-20550 82.9132.145 05:36:43.34 -69:06:07.1 17.03 -0.34 -0.116 -0.352 -0.090 OGLE LMC-ECL-20589 82.9130.25 05:36:48.74 -69:16:59.4 15.19 -0.13 -0.271 -0.109 -0.292 OGLE LMC-ECL-20648 81.9127.131 05:36:56.90 -69:28:50.3 16.65 0.09 -0.185 -0.010 -0.235 OGLE LMC-ECL-20735 SC16 240980 81.9238.590 05:37:07.73 -70:09:38.3 17.88 – – 0.092 0.021 OGLE LMC-ECL-20783^∗ SC16 226238 11.9235.33 05:37:14.02 -70:20:01.5 15.67 – – 0.329 -0.409 OGLE LMC-ECL-20860 81.9246.29 05:37:24.44 -69:34:19.6 15.87 – – -0.222 -0.173 OGLE LMC-ECL-21259 05:38:20.42 -69:03:10.4 15.98 0.69 -0.430 0.296 -0.267 OGLE LMC-ECL-21278 05:38:22.59 -69:21:04.5 17.38 – – 0.361 -0.272 OGLE LMC-ECL-21479 05:38:46.72 -69:02:40.5 16.84 – – -0.451 -0.038 OGLE LMC-ECL-21647 50.9634.17 05:39:12.03 -67:55:54.1 16.54 -0.08 -0.173 -0.014 -0.200 OGLE LMC-ECL-21695 05:39:22.14 -68:31:58.2 16.85 -0.09 -0.181 -0.304 -0.142 OGLE LMC-ECL-21961^∗ 05:40:02.01 -69:22:10.6 17.48 – – 0.548 -0.445 OGLE LMC-ECL-21968 05:40:03.22 -69:19:54.7 15.90 – – 0.041 -0.244 OGLE LMC-ECL-22069 05:40:17.90 -69:31:31.8 17.65 – – 0.393 -0.308 OGLE LMC-ECL-22211^∗ 76.9730.1611 05:40:38.42 -69:36:22.6 17.37 – – 0.224 -0.345 OGLE LMC-ECL-22232 SC18 107244 76.9845.63 05:40:41.43 -69:59:01.4 16.39 – – -0.040 -0.212 OGLE LMC-ECL-22422^∗ 05:41:10.20 -69:19:30.3 17.97 – – 0.284 -0.316 OGLE LMC-ECL-22455 SC18 66331 11.9835.112 05:41:13.80 -70:39:49.5 17.18 – – 0.105 -0.210 OGLE LMC-ECL-22494 76.9849.541 05:41:19.17 -69:41:43.3 18.59 – – 0.088 -0.129 OGLE LMC-ECL-22613^∗ 15.9946.7 05:41:37.74 -71:19:02.8 14.77 – – 0.304 -0.529 OGLE LMC-ECL-22695^∗ 76.9970.41 05:41:50.30 -69:42:24.5 16.13 – – -1.182 0.522 OGLE LMC-ECL-23298 05:43:26.23 -69:16:25.5 15.47 0.01 -0.275 0.118 -0.279 OGLE LMC-ECL-23323 05:43:32.02 -69:13:40.6 17.49 – – -0.007 -0.155 OGLE LMC-ECL-23920 05:45:54.86 -69:13:44.1 17.53 – – 0.070 -0.189 OGLE LMC-ECL-24112 76.10813.52 05:46:44.34 -70:00:37.8 16.69 – – 0.085 -0.153 OGLE LMC-ECL-24236^∗ 05:47:18.17 -69:39:18.5 17.55 – – 0.168 -0.333 OGLE LMC-ECL-24534 05:48:43.17 -70:01:00.3 16.24 – – -0.033 -0.292 OGLE LMC-ECL-24817 05:50:12.61 -69:55:26.4 18.10 – – -0.287 -0.085 OGLE LMC-ECL-25047 05:51:51.36 -70:01:21.1 18.05 – – -0.072 -0.213 OGLE LMC-ECL-25227 30.11783.137 05:53:17.33 -69:53:13.2 18.02 – – -0.067 -0.183 OGLE LMC-ECL-25743^∗ 06:04:25.47 -68:55:28.1 15.29 – – 0.105 -0.417 OGLE LMC-ECL-25885 06:07:52.60 -71:46:42.9 17.88 – – 0.059 -0.023 OGLE LMC-ECL-25980^∗ 06:10:48.42 -69:52:17.5 17.09 – – – –

Article number, page 19 of 25

Table A.3. Parameters of the light curve fits and the apsidal motion.

System i T_1 T_2 L_1 L_2 L_3 R_1/a R_2/a HJD_0 P [d] e ω [deg] U [yr] [deg] [K] [K] [%] [%] [% ] [2450000+] OGLE LMC-ECL-00127 80.31 (0.54) 12500 (fixed) 12153 (189) 57.6 (1.9) 42.3 (1.7) 0 0.252 (5) 0.230 (3) 3400.7935 (24) 1.9716646 (19) 0.020 (8) 118.3 (1.2) 47.8 (4.9) OGLE LMC-ECL-00442 87.02 (1.12) 29000 (fixed) 18691 (302) 78.7 (2.3) 11.3 (1.2) 10.0 (0.7) 0.194 (3) 0.108 (4) 5552.2497 (115) 3.4108511 (123) 0.341 (17) 49.7 (7.8) 94.1 (10.3) OGLE LMC-ECL-00483 86.94 (0.96) 15700 (fixed) 9767 (619) 70.4 (7.0) 12.3 (2.3) 17.3 (5.2) 0.197 (11) 0.118 (9) 5551.8390 (89) 1.9408981 (57) 0.139 (26) 186.9 (15.3) 77.0 (24.7) OGLE LMC-ECL-00510 83.71 (0.67) 8270 (fixed) 8179 (118) 50.7 (2.1) 46.3 (0.8) 2.9 (1.3) 0.228 (3) 0.217 (2) 5552.2803 (92) 2.4828516 (130) 0.096 (12) 171.9 (6.7) 106.7 (18.9) OGLE LMC-ECL-00527 80.68 (0.35) 8150 (fixed) 7388 (103) 63.2 (1.5) 36.7 (1.4) 0 0.227 (2) 0.194 (2) 5552.5222 (21) 1.7258405 (14) 0.045 (16) 106.0 (2.3) 57.9 (11.5) OGLE LMC-ECL-00648 84.13 (0.64) 16200 (fixed) 14675 (257) 77.3 (2.6) 20.1 (1.3) 2.7 (2.0) 0.276 (3) 0.151 (4) 5553.3481 (33) 1.5805259 (29) 0.046 (11) 106.1 (2.0) 26.8 (9.0) OGLE LMC-ECL-00652 86.34 (0.29) 20600 (fixed) 21103 (222) 25.1 (1.2) 74.9 (2.0) 0 0.139 (2) 0.232 (3) 5553.0384 (102) 3.2610612 (213) 0.202 (21) 68.1 (9.4) 92.1 (12.6) OGLE LMC-ECL-00666 88.21 (0.56) 30000 (fixed) 21888 (511) 45.4 (3.2) 12.7 (1.3) 41.9 (2.8) 0.247 (5) 0.163 (4) 5552.9386 (24) 1.6029021 (20) 0.036 (10) 162.6 (1.8) 39.9 (5.2) OGLE LMC-ECL-00737 89.27 (0.24) 20600 (fixed) 20615 (210) 49.0 (0.4) 51.0 (0.5) 0 0.209 (3) 0.211 (3) 5601.1048 (45) 1.9848417 (86) 0.111 (32) 310.5 (3.4) 44.1 (8.9) OGLE LMC-ECL-00868 85.18 (0.71) 10700 (fixed) 11476 (234) 35.3 (1.8) 59.6 (2.1) 5.1 (1.2) 0.148 (2) 0.183 (3) 5600.2204 (123) 2.2747035 (224) 0.203 (36) 167.1 (12.9) 114.8 (18.2) OGLE LMC-ECL-00872 88.29 (0.85) 17800 (fixed) 14181 (427) 67.2 (0.3) 32.8 (0.3) 0 0.227 (3) 0.186 (4) 5600.0326 (37) 1.2823707 (23) 0.071 (17) 127.6 (2.5) 32.8 (1.8) OGLE LMC-ECL-00929 89.53 (0.59) 8170 (fixed) 7890 (208) 56.0 (2.5) 44.0 (2.2) 0 0.177 (5) 0.163 (9) 5600.4775 (78) 1.8515324 (103) 0.210 (45) 262.5 (12.0) 103.9 (19.3) OGLE LMC-ECL-00955 85.37 (0.37) 14000 (fixed) 17175 (536) 35.6 (1.7) 60.3 (0.7) 4.1 (2.9) 0.144 (5) 0.162 (6) 5599.7752 (146) 2.8025063 (221) 0.209 (59) 126.6 (11.9) 195.1 (33.0) OGLE LMC-ECL-01445 86.61 (0.22) 12500 (fixed) 12380 (155) 57.8 (1.2) 32.6 (0.5) 9.6 (6.1) 0.236 (2) 0.179 (2) 6001.9480 (89) 2.2912938 (68) 0.129 (20) 164.4 (7.1) 54.5 (5.8) OGLE LMC-ECL-02912 78.18 (0.52) 14000 (fixed) 13031 (213) 58.4 (2.0) 39.0 (1.8) 2.6 (1.8) 0.224 (4) 0.195 (3) 6001.7281 (14) 2.1106452 (17) 0.020 (11) 264.0 (17.2) 71.9 (18.3) OGLE LMC-ECL-02943 81.87 (0.47) 10700 (fixed) 10044 (135) 60.2 (1.3) 38.8 (1.7) 0.9 (0.8) 0.203 (7) 0.167 (5) 6002.3439 (33) 3.2126214 (30) 0.090 (23) 100.1 (1.8) 112.8 (13.2) OGLE LMC-ECL-04957 89.33 (0.43) 10000 (fixed) 9383 (115) 60.8 (1.4) 39.2 (1.0) 0 0.224 (2) 0.189 (2) 5003.0905 (23) 1.4541166 (11) 0.065 (8) 87.0 (2.4) 37.4 (3.9) OGLE LMC-ECL-05345 83.85 (0.27) 26000 (fixed) 26050 (288) 56.0 (0.9) 43.4 (1.1) 0.6 (0.5) 0.182 (2) 0.162 (3) 5002.5639 (91) 4.0348631 (121) 0.261 (22) 137.2 (6.0) 131.4 (14.7) OGLE LMC-ECL-06837 83.10 (0.39) 22500 (fixed) 21103 (319) 54.8 (1.5) 45.2 (1.2) 0 0.175 (4) 0.165 (3) 6002.6578 (52) 2.7470370 (42) 0.048 (7) 104.8 (1.3) 9.9 (0.6) OGLE LMC-ECL-07578 88.03 (0.48) 20600 (fixed) 19882 (257) 52.2 (0.9) 28.7 (1.0) 19.1 (2.3) 0.211 (4) 0.186 (7) 5002.8096 (78) 4.0185993 (98) 0.141‘(15) 316.8 (7.9) 146.0 (15.2) OGLE LMC-ECL-07585 88.88 (0.54) 11000 (fixed) 9850 (210) 54.3 (1.6) 45.6 (1.4) 0 0.201 (5) 0.198 (4) 5000.7113 (34) 1.5331843 (40) 0.059 (22) 302.7 (18.8) 39.1 (22.3) OGLE LMC-ECL-07641 82.32 (0.80) 18500 (fixed) 19364 (776) 33.7 (1.2) 50.2 (2.2) 16.1 (3.4) 0.154 (7) 0.181 (6) 5495.0273 (112) 6.3299708 (230) 0.265 (110) 89.8 (9.0) 198.9 (52.6) OGLE LMC-ECL-07838 87.69 (1.09) 17000 (fixed) 16180 (328) 63.6 (3.0) 35.2 (1.6) 1.2 (1.2) 0.233 (4) 0.169 (5) 4002.2882 (61) 2.6211802 (81) 0.123 (43) 102.2 (2.7) 83.3 (10.9) OGLE LMC-ECL-08311 75.76 (0.31) 23500 (fixed) 17805 (241) 64.4 (1.1) 35.6 (0.7) 0 0.219 (2) 0.202 (3) 4001.6423 (53) 2.3454109 (42) 0.107 (12) 84.7 (4.4) 35.4 (1.3) OGLE LMC-ECL-08397 83.80 (0.62) 30000 (fixed) 26080 (136) 42.8 (5.2) 30.7 (3.1) 26.5 (4.6) 0.207 (7) 0.200 (4) 4003.0302 (107) 3.1317961 (170) 0.169 (21) 138.9 (7.1) 58.6 (3.4) OGLE LMC-ECL-08439 86.11 (1.08) 16700 (fixed) 16657 (505) 42.7 (3.3) 37.7 (2.0) 19.6 (4.8) 0.247 (6) 0.233 (3) 4002.1008 (32) 2.0488466 (12) 0.040 (7) 71.0 (1.6) 39.5 (3.1) OGLE LMC-ECL-08752 80.74 (0.35) 31500 (fixed) 24970 (213) 62.7 (0.9) 37.3 (0.7) 0 0.221 (3) 0.211 (3) 6157.0514 (44) 2.6788383 (65) 0.039 (9) 14.1 (2.2) 49.6 (5.0) OGLE LMC-ECL-08859 77.79 (0.59) 10000 (fixed) 8721 (234) 51.8 (1.4) 38.1 (1.6) 10.1 (3.5) 0.245 (6) 0.233 (5) 4001.5476 (9) 1.0877549 (5) 0.046 (4) 249.4 (1.1) 15.7 (1.2) OGLE LMC-ECL-09186 81.78 (0.12) 24500 (fixed) 28734 (108) 41.6 (0.8) 58.4 (0.9) 0 0.182 (3) 0.186 (4) 5002.6794 (69) 3.7734723 (141) 0.236 (16) 148.1 (5.9) 126.1 (34.9) OGLE LMC-ECL-10302 75.99 (1.27) 24500 (fixed) 22720 (297) 25.0 (0.3) 19.8 (0.4) 55.2 (1.4) 0.234 (2) 0.220 (3) 4001.0612 (6) 1.5401250 (12) 0.008 (2) 35.2 (6.0) 17.9 (1.4) OGLE LMC-ECL-10377 85.42 (0.46) 20600 (fixed) 17949 (132) 56.7 (2.7) 43.3 (2.5) 0 0.240 (9) 0.214 (8) 2246.1620 (8) 2.1087293 (11) 0.030 (4) 329.8 (4.3) 32.7 (2.1) OGLE LMC-ECL-10446 80.17 (0.91) 10000 (fixed) 9025 (204) 59.3 (1.6) 36.4 (2.1) 4.3 (2.7) 0.230 (11) 0.193 (9) 5001.3796 (59) 2.1452228 (77) 0.096 (13) 146.9 (4.8) 36.4 (8.5) OGLE LMC-ECL-10601 79.62 (0.28) 17000 (fixed) 14687 (190) 65.7 (0.6) 34.3 (0.5) 0 0.205 (3) 0.164 (3) 4002.0628 (179) 3.2837060 (242) 0.225 (63) 156.0 (11.7) 119.4 (28.9) OGLE LMC-ECL-10672 88.34 (0.83) 20600 (fixed) 17942 (275) 65.7 (2.4) 32.6 (1.9) 1.7 (1.4) 0.240 (4) 0.187 (5) 4002.4626 (11) 1.7056091 (14) 0.031 (9) 293.3 (12.9) 52.8 (19.3) OGLE LMC-ECL-10867 82.86 (0.25) 18500 (fixed) 17569 (174) 63.7 (2.1) 36.3 (1.7) 0 0.236 (5) 0.176 (7) 4002.4395 (19) 1.8582461 (25) 0.043 (11) 296.4 (7.2) 60.5 (11.0) OGLE LMC-ECL-11183 87.77 (1.07) 16000 (fixed) 26957 (503) 5.7 (0.8) 48.4 (8.2) 45.9 (7.0) 0.155 (8) 0.298 (11) 4000.9668 (85) 2.5808061 (107) 0.199 (13) 88.5 (9.4) 48.1 (7.6) OGLE LMC-ECL-11320 84.51 (0.30) 14500 (fixed) 14410 (162) 63.3 (1.5) 34.1 (1.3) 2.6 (2.1) 0.243 (2) 0.178 (2) 4002.9282 (30) 2.5380708 (62) 0.052 (16) 123.0 (11.8) 74.5 (15.2) OGLE LMC-ECL-11351 77.87 (0.29) 17000 (fixed) 20072 (266) 52.0 (0.7) 48.0 (0.6) 0 0.212 (3) 0.181 (3) 4002.9247 (72) 2.4103248 (69) 0.150 (23) 64.7 (5.0) 92.5 (13.7) OGLE LMC-ECL-11374 87.94 (0.32) 12500 (fixed) 12544 (137) 55.3 (1.4) 43.8 (1.7) 0.9 (0.8) 0.231 (4) 0.210 (5) 4003.4547 (25) 2.0154752 (26) 0.045 (12) 23.9 (3.1) 88.0 (22.8) OGLE LMC-ECL-11680 81.45 (0.35) 10000 (fixed) 10386 (177) 48.6 (0.9) 51.4 (1.1) 0 0.183 (2) 0.185 (2) 4001.6785 (56) 2.1649015 (68) 0.131 (30) 61.1 (4.0) 72.0 (5.1) OGLE LMC-ECL-11854 80.37 (0.19) 17000 (fixed) 16556 (252) 72.9 (2.6) 24.4 (0.9) 2.7 (1.7) 0.259 (3) 0.153 (3) 5001.3761 (18) 2.4000588 (35) 0.041 (12) 71.5 (2.9) 66.3 (4.3) OGLE LMC-ECL-11929 75.30 (0.48) 23000 (fixed) 21808 (119) 66.1 (1.7) 33.1 (0.8) 0.8 (0.8) 0.281 (5) 0.210 (4) 5000.9802 (61) 4.4228109 (101) 0.050 (13) 355.5 (4.5) 87.8 (5.0) OGLE LMC-ECL-12002 81.65 (0.17) 20600 (fixed) 18815 (185) 57.7 (0.7) 42.3 (0.8) 0 0.208 (4) 0.192 (5) 4000.5253 (40) 2.1911826 (129) 0.064 (19) 141.6 (3.8) 57.4 (9.2) OGLE LMC-ECL-12043 81.71 (2.30) 14500 (fixed) 15377 (395) 31.5 (2.2) 41.2 (3.0) 27.3 (4.9) 0.199 (12) 0.205 (11) 4002.7978 (41) 1.3432745 (73) 0.150 (14) 146.1 (2.3) 48.7 (4.6) OGLE LMC-ECL-12234 83.48 (0.38) 16000 (fixed) 15342 (240) 68.7 (0.6) 29.2 (0.7) 2.1 (1.4) 0.252 (2) 0.171 (2) 5003.9357 (68) 2.5755734 (91) 0.108 (15) 205.7 (3.0) 87.9 (2.1) OGLE LMC-ECL-12323 86.39 (0.21) 20600 (fixed) 20872 (351) 51.3 (1.3) 45.8 (2.2) 2.9 (2.5) 0.146 (2) 0.142 (3) 4002.3660 (162) 2.9617909 (164) 0.319 (22) 61.9 (12.7) 183.7 (33.9) OGLE LMC-ECL-12504 80.94 (0.33) 15000 (fixed) 18530 (313) 23.7 (3.1) 44.3 (3.7) 32.0 (5.0) 0.181 (4) 0.217 (5) 4002.5246 (59) 2.3873668 (117) 0.175 (41) 65.0 (4.8) 159.4 (48.0) OGLE LMC-ECL-12513 82.04 (0.75) 14000 (fixed) 12527 (329) 31.3 (1.5) 17.0 (0.9) 51.7 (6.2) 0.212 (9) 0.164 (6) 3539.6785 (38) 1.6462861 (32) 0.110 (27) 109.1 (3.2) 44.1 (9.4) OGLE LMC-ECL-12687 79.39 (0.37) 10400 (fixed) 9309 (188) 60.8 (2.0) 39.2 (1.8) 0 0.244 (5) 0.213 (3) 4003.0971 (11) 1.6872665 (10) 0.031 (4) 19.3 (4.6) 32.2 (2.7) OGLE LMC-ECL-12792 83.98 (0.82) 8300 (fixed) 8179 (214) 50.7 (2.4) 48.4 (1.1) 0.9 (0.8) 0.246 (7) 0.238 (4) 4002.9299 (14) 1.7357179 (88) 0.047 (21) 253.9 (3.7) 194.2 (74.8) OGLE LMC-ECL-13039 84.12 (0.34) 13500 (fixed) 13557 (156) 37.0 (0.5) 63.0 (0.5) 0 0.172 (2) 0.223 (2) 4003.1363 (29) 1.5053762 (31) 0.096 (5) 9.1 (12.4) 45.5 (3.1) OGLE LMC-ECL-13198 78.55 (0.16) 16000 (fixed) 18256 (302) 44.2 (0.6) 54.9 (0.7) 0.9 (0.5) 0.201 (3) 0.203 (4) 4001.4109 (51) 2.1174661 (74) 0.114 (11) 36.1 (4.9) 63.0 (4.9) OGLE LMC-ECL-13202 88.82 (0.32) 10400 (fixed) 11061 (135) 42.6 (0.8) 54.6 (1.1) 2.8 (0.7) 0.187 (2) 0.202 (2) 4002.3909 (67) 2.2752552 (111) 0.151 (32) 66.0 (2.8) 81.7 (11.0) OGLE LMC-ECL-13321 83.80 (0.19) 18500 (fixed) 21923 (238) 41.8 (0.5) 58.7 (0.9) 0 0.185 (4) 0.198 (9) 4000.9603 (33) 1.6517623 (42) 0.160 (46) 114.8 (2.1) 63.0 (29.6) OGLE LMC-ECL-13407 80.31 (0.35) 11500 (fixed) 11130 (185) 51.9 (0.7) 48.1 (0.5) 0 0.217 (4) 0.215 (3) 4001.9580 (26) 1.9333573 (25) 0.080 (6) 96.7 (2.7) 62.7 (5.2) OGLE LMC-ECL-13452 85.36 (0.23) 24500 (fixed) 23186 (123) 53.6 (1.0) 46.3 (0.8) 0 0.207 (3) 0.201 (2) 4002.0813 (37) 1.9627478 (56) 0.086 (4) 333.4 (1.6) 39.2 (2.5) OGLE LMC-ECL-13467 85.71 (0.39) 25200 (fixed) 23906 (174) 55.5 (1.6) 43.7 (0.9) 0.8 (0.6) 0.231 (3) 0.214 (3) 4002.3241 (34) 2.5059763 (61) 0.063 (10) 80.7 (3.0) 46.9 (3.7) OGLE LMC-ECL-13567 87.52 (0.48) 8400 (fixed) 7875 (49) 59.4 (0.7) 40.2 (0.6) 0.5 (0.5) 0.259 (2) 0.227 (2) 4001.6849 (9) 1.1749927 (8) 0.021 (2) 83.2 (1.4) 14.1 (1.1) OGLE LMC-ECL-13601 80.49 (0.14) 19000 (fixed) 19481 (166) 46.5 (0.6) 55.5 (0.6) 0 0.192 (2) 0.202 (3) 4003.4649 (25) 2.5988993 (33) 0.097 (22) 100.1 (2.8) 91.2 (12.3) OGLE LMC-ECL-13809 88.90 (0.19) 18000 (fixed) 16362 (145) 47.6 (0.8) 44.0 (1.0) 8.2 (2.4) 0.214 (3) 0.213 (3) 4002.1345 (27) 1.7508997 (52) 0.073 (25) 68.7 (4.7) 34.9 (10.8) OGLE LMC-ECL-13842 80.13 (0.25) 26000 (fixed) 19994 (117) 62.8 (2.3) 37.0 (1.4) 0.2 (0.2) 0.209 (4) 0.201 (4) 4002.1696 (66) 2.2447821 (204) 0.110 (33) 128.9 (5.9) 46.3 (13.0) OGLE LMC-ECL-13851 81.61 (0.16) 17000 (fixed) 15948 (102) 53.8 (0.9) 46.2 (0.7) 0 0.230 (2) 0.223 (3) 4000.1045 (39) 2.7544935 (64) 0.080 (17) 138.7 (3.6) 69.5 (14.4) OGLE LMC-ECL-13902 81.11 (0.85) 17000 (fixed) 10077 (258) 70.5 (2.8) 19.6 (3.5) 9.9 (0.7) 0.238 (7) 0.187 (9) 4003.7461 (33) 1.4033760 (69) 0.107 (24) 128.5 (2.5) 31.6 (8.2) OGLE LMC-ECL-14013 81.27 (0.72) 26000 (fixed) 21561 (847) 46.6 (0.9) 28.5 (0.8) 24.9 (1.9) 0.189 (3) 0.176 (3) 3000.9749 (130) 2.2729766 (141) 0.242 (77) 35.9 (8.8) 40.1 (11.1) OGLE LMC-ECL-14159 84.01 (0.38) 16700 (fixed) 14950 (159) 58.3 (0.5) 41.7 (0.4) 0 0.179 (3) 0.162 (4) 5600.6748 (49) 2.2433740 (50) 0.125 (49) 87.1 (4.0) 185.3 (77.9) OGLE LMC-ECL-14462 73.79 (0.89) 20600 (fixed) 16523 (320) 54.6 (0.9) 35.7 (0.7) 9.7 (1.6) 0.228 (7) 0.216 (5) 4002.8059 (24) 1.8869262 (22) 0.042 (11) 185.7 (3.2) 22.4 (2.0) OGLE LMC-ECL-15161 78.11 (0.17) 13200 (fixed) 12197 (105) 49.4 (0.5) 43.3 (0.4) 7.3 (0.7) 0.235 (2) 0.234 (2) 4001.6262 (29) 3.6255092 (73) 0.090 (52) 95.6 (13.8) 134.0 (34.7) OGLE LMC-ECL-15288 74.77 (0.22) 20600 (fixed) 20437 (123) 43.3 (0.4) 41.0 (0.5) 15.7 (2.1) 0.227 (3) 0.222 (2) 4001.2285 (31) 2.6743442 (46) 0.057 (10) 79.9 (4.1) 55.1 (2.8) OGLE LMC-ECL-15386 81.25 (0.36) 10400 (fixed) 10300 (182) 48.3 (0.7) 47.8 (0.6) 3.9 (1.2) 0.228 (2) 0.226 (2) 4001.9444 (77) 2.5117115 (116) 0.120 (16) 195.3 (8.4) 84.1 (15.9) OGLE LMC-ECL-15441 83.94 (0.50) 14000 (fixed) 11324 (212) 58.7 (1.1) 38.5 (1.0) 2.8 (1.4) 0.167 (4) 0.158 (3) 4001.3043 (170) 2.8857944 (168) 0.280 (92) 222.1 (12.7) 184.1 (29.6) OGLE LMC-ECL-15473 76.17 (0.43) 12500 (fixed) 13308 (270) 37.2 (0.9) 39.9 (1.8) 22.9 (2.5) 0.205 (2) 0.206 (2) 6001.2646 (41) 1.5892106 (31) 0.094 (11) 111.5 (2.2) 48.2 (3.0) OGLE LMC-ECL-15496 82.79 (0.38) 9200 (fixed) 8061 (111) 58.4 (1.3) 30.4 (0.5) 11.2 (2.0) 0.195 (4) 0.161 (5) 3563.1201 (67) 2.1826978 (125) 0.186 (51) 231.9 (9.8) 162.0 (55.4) OGLE LMC-ECL-15664 82.47 (1.42) 26000 (fixed) 16725 (435) 20.9 (2.4) 7.3 (1.7) 71.8 (3.6) 0.218 (7) 0.184 (5) 5600.4875 (65) 1.8189578 (60) 0.161 (10) 330.9 (2.0) 41.7 (2.3) OGLE LMC-ECL-15764 87.89 (0.59) 10400 (fixed) 9442 (209) 62.1 (1.8) 34.1 (2.0) 3.8 (1.7) 0.185 (5) 0.144 (3) 3569.6766 (155) 2.6937937 (201) 0.283 (68) 1.8 (4.9) 152.2 (13.7) OGLE LMC-ECL-15779 82.44 (0.41) 8550 (fixed) 8109 (252) 43.8 (0.5) 27.5 (0.4) 28.7 (0.6) 0.205 (3) 0.168 (3) 2245.4017 (108) 2.5036353 (69) 0.126 (29) 124.6 (3.8) 132.3 (37.8) OGLE LMC-ECL-16178 72.58 (0.35) 25500 (fixed) 25320 (263) 49.7 (1.2) 46.8 (0.9) 3.5 (2.2) 0.260 (4) 0.255 (2) 4001.2445 (8) 1.6616695 (9) 0.023 (3) 271.8 (0.9) 14.8 (1.0) OGLE LMC-ECL-16310 81.67 (0.18) 29000 (fixed) 27393 (120) 53.9 (0.6) 46.1 (0.5) 0 0.234 (2) 0.228 (2) 4002.7397 (22) 2.6313468 (25) 0.029 (8) 318.6 (3.1) 47.7 (2.6) OGLE LMC-ECL-16320 89.73 (0.33) 23000 (fixed) 21847 (237) 56.3 (0.9) 42.6 (0.7) 1.1 (1.5) 0.243 (7) 0.221 (7) 4001.5891 (9) 2.1091399 (14) 0.011 (4) 96.5 (2.5) 31.2 (4.9) OGLE LMC-ECL-16414 77.48 (0.30) 17700 (fixed) 19193 (326) 29.4 (0.7) 39.1 (1.4) 31.5 (2.4) 0.187 (3) 0.208 (6) 4001.2263 (61) 2.2425933 (115) 0.125 (19) 96.6 (4.2) 51.4 (10.5) OGLE LMC-ECL-16442 89.82 (0.77) 15700 (fixed) 14992 (394) 59.0 (0.8) 41.0 (0.5) 0 0.205 (6) 0.180 (4) 4001.8600 (43) 1.5621158 (48) 0.178 (28) 134.6 (3.4) 70.4 (7.2) OGLE LMC-ECL-16625 85.17 (0.21) 24500 (fixed) 23898 (145) 56.1 (1.6) 41.6 (1.3) 2.2 (1.0) 0.253 (2) 0.223 (2) 4001.5240 (11) 2.6142420 (31) 0.016 (8) 229.5 (12.3) 30.8 (11.0) OGLE LMC-ECL-16732 70.56 (0.15) 24500 (fixed) 22786 (212) 42.5 (0.8) 37.6 (0.7) 19.9 (2.1) 0.241 (1) 0.241 (1) 4000.7492 (10) 2.2506837 (21) 0.025 (9) 65.4 (7.6) 38.1 (5.1)

Article number, page 20 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 13. Plot of the O − C diagrams after subtraction of apsidal motion fits. The LTE variations are plotted as red curves.

Article number, page 21 of 25

Table A.4. Parameters of the light curve fits and the apsidal motion, continuation.

System i T_1 T_2 L_1 L_2 L_3 R_1/a R_2/a HJD_0 P [d] e ω [deg] U [yr] [deg] [K] [K] [%] [%] [% ] [2450000+] OGLE LMC-ECL-16925 86.89 (0.34) 24500 (fixed) 21558 (263) 53.4 (1.6) 42.7 (1.5) 3.9 (2.0) 0.171 (4) 0.170 (3) 4001.3216 (61) 2.3068163 (101) 0.185 (46) 63.7 (8.7) 61.7 (15.8) OGLE LMC-ECL-16928 82.78 (0.28) 10400 (fixed) 10160 (146) 48.4 (1.1) 44.0 (1.0) 7.6 (3.3) 0.172 (3) 0.167 (3) 4001.3706 (133) 2.8187346 (206) 0.245 (66) 139.6 (11.0) 154.6 (22.0) OGLE LMC-ECL-16983 83.96 (0.29) 14000 (fixed) 11517 (173) 59.3 (2.0) 40.7 (1.4) 0 0.206 (3) 0.199 (2) 4001.5687 (27) 1.6403939 (30) 0.101 (11) 121.4 (2.1) 56.5 (7.2) OGLE LMC-ECL-17030 85.61 (0.52) 14500 (fixed) 13369 (317) 57.1 (1.6) 38.5 (2.2) 4.4 (1.7) 0.194 (5) 0.170 (7) 4001.5758 (140) 2.5185395 (219) 0.212 (80) 208.2 (14.6) 114.9 (20.9) OGLE LMC-ECL-17042 80.98 (0.27) 20600 (fixed) 22193 (224) 46.6 (0.6) 53.4 (0.7) 0 0.180 (2) 0.182 (3) 4002.4456 (83) 2.6105475 (135) 0.200 (34) 127.8 (4.5) 80.3 (9.8) OGLE LMC-ECL-17183 83.41 (0.43) 10400 (fixed) 11587 (163) 36.6 (1.0) 53.0 (1.2) 11.3 (1.2) 0.182 (7) 0.201 (8) 4001.7230 (57) 2.2069498 (85) 0.158 (16) 133.7 (8.0) 112.6 (7.9) OGLE LMC-ECL-17198 82.48 (0.50) 24500 (fixed) 23583 (208) 29.1 (1.7) 28.1 (1.3) 42.8 (2.4) 0.226 (4) 0.222 (3) 5000.1246 (69) 3.2908144 (224) 0.079 (13) 155.3 (5.7) 74.7 (16.1) OGLE LMC-ECL-17223 76.32 (0.38) 17500 (fixed) 16835 (531) 54.7 (1.9) 37.5 (1.6) 7.8 (3.0) 0.170 (5) 0.144 (5) 5000.6431 (138) 2.6021867 (379) 0.208 (75) 134.0 (14.3) 104.9 (36.7) OGLE LMC-ECL-17226 86.04 (0.45) 9500 (fixed) 8802 (193) 59.3 (1.4) 40.7 (1.2) 0 0.253 (4) 0.237 (8) 6000.6648 (9) 0.9879314 (10) 0.037 (4) 319.9 (3.6) 11.9 (1.0) OGLE LMC-ECL-17236 77.27 (0.43) 10400 (fixed) 9976 (309) 45.9 (1.1) 30.1 (1.7) 24.0 (3.5) 0.226 (3) 0.183 (3) 4002.6218 (42) 1.5755586 (104) 0.118 (19) 52.2 (4.1) 29.6 (3.4) OGLE LMC-ECL-17267 70.88 (0.32) 25000 (fixed) 19240 (286) 43.8 (0.9) 27.3 (1.4) 28.9 (1.6) 0.238 (4) 0.236 (2) 5001.2120 (51) 1.8805590 (52) 0.032 (5) 25.1 (2.7) 28.1 (1.6) OGLE LMC-ECL-17283 83.26 (0.23) 15700 (fixed) 12316 (152) 54.8 (1.6) 37.4 (0.8) 7.8 (2.3) 0.186 (3) 0.181 (3) 4003.4638 (93) 2.0727585 (160) 0.227 (43) 173.4 (5.0) 59.6 (4.8) OGLE LMC-ECL-17299 83.11 (0.26) 10400 (fixed) 9947 (145) 58.4 (2.3) 41.6 (1.8) 0 0.194 (5) 0.174 (4) 4001.6258 (64) 1.7431951 (9) 0.203 (14) 72.7 (2.4) 74.5 (11.2) OGLE LMC-ECL-17406 85.17 (0.91) 21000 (fixed) 12184 (270) 38.9 (1.7) 6.1 (0.5) 55.0 (3.2) 0.237 (3) 0.139 (2) 5002.9681 (11) 1.9407060 (34) 0.120 (72) 93.8 (13.2) 110.6 (24.1) OGLE LMC-ECL-17498 86.01 (0.29) 16700 (fixed) 12948 (201) 57.2 (1.2) 39.5 (1.0) 3.3 (1.0) 0.180 (3) 0.174 (2) 4000.1153 (90) 2.5878412 (162) 0.251 (12) 256.0 (6.6) 132.7 (10.7) OGLE LMC-ECL-17543 82.12 (0.17) 12500 (fixed) 11669 (102) 57.1 (0.9) 40.7 (2.0) 2.2 (1.4) 0.187 (4) 0.168 (2) 4000.0572 (52) 2.6029786 (90) 0.106 (20) 138.8 (3.8) 131.3 (32.0) OGLE LMC-ECL-17579 77.23 (0.71) 24000 (fixed) 20518 (263) 32.5 (0.8) 23.4 (2.7) 44.1 (4.8) 0.236 (3) 0.233 (3) 4001.1745 (18) 1.5486575 (44) 0.041 (17) 267.4 (13.9) 72.1 (26.9) OGLE LMC-ECL-17711 73.22 (0.10) 20600 (fixed) 20232 (179) 53.1 (0.4) 46.7 (0.4) 0.2 (0.2) 0.227 (2) 0.217 (2) 4000.9684 (15) 1.9613503 (21) 0.037 (7) 71.8 (1.5) 31.7 (2.3) OGLE LMC-ECL-17718 87.23 (0.38) 10700 (fixed) 9978 (99) 53.0 (0.6) 47.0 (0.7) 0 0.203 (3) 0.202 (3) 5501.6279 (19) 2.0641028 (19) 0.039 (14) 142.5 (9.7) 66.7 (11.4) OGLE LMC-ECL-17774 79.35 (0.23) 25500 (fixed) 23836 (333) 32.2 (1.7) 29.8 (1.3) 38.0 (3.5) 0.188 (4) 0.174 (3) 5798.4747 (47) 3.9294300 (173) 0.070 (13) 319.7 (3.4) 7.2 (0.2) OGLE LMC-ECL-17777 86.17 (0.31) 20600 (fixed) 20376 (176) 52.4 (0.9) 47.0 (1.1) 0.6 (0.6) 0.199 (2) 0.195 (2) 4002.2267 (91) 2.8638071 (160) 0.125 (11) 35.8 (6.1) 87.3 (7.8) OGLE LMC-ECL-17800 74.26 (0.14) 17700 (fixed) 11632 (188) 62.8 (1.3) 28.7 (0.9) 8.5 (1.3) 0.237 (4) 0.222 (3) 4001.9965 (12) 1.4354526 (12) 0.035 (12) 206.8 (5.0) 20.5 (1.7) OGLE LMC-ECL-17809 87.98 (0.32) 10400 (fixed) 10551 (97) 47.9 (1.0) 52.1 (0.9) 0 0.210 (2) 0.213 (3) 4002.3658 (49) 2.2079038 (85) 0.111 (30) 65.0 (3.8) 70.2 (4.0) OGLE LMC-ECL-17923 89.53 (0.49) 15700 (fixed) 15628 (129) 52.9 (0.5) 47.1 (0.4) 0 0.208 (2) 0.196 (2) 4002.8307 (77) 2.5538851 (145) 0.150 (27) 145.7 (5.5) 82.6 (14.1) OGLE LMC-ECL-18077 82.54 (0.60) 10700 (fixed) 12604 (300) 39.4 (0.6) 52.9 (1.8) 7.7 (1.6) 0.159 (5) 0.165 (6) 5002.2916 (31) 1.7835501 (88) 0.221 (98) 88.5 (18.7) 112.9 (35.6) OGLE LMC-ECL-18152 78.24 (0.29) 26000 (fixed) 22707 (328) 64.1 (0.9) 32.3 (1.2) 3.6 (2.0) 0.208 (4) 0.168 (4) 5001.9415 (47) 2.5629074 (168) 0.098 (22) 98.3 (7.7) 45.5 (8.2) OGLE LMC-ECL-18174 79.75 (0.15) 10700 (fixed) 11510 (125) 44.3 (0.4) 55.7 (0.4) 0 0.207 (2) 0.219 (2) 4003.0395 (39) 2.5366697 (63) 0.129 (11) 123.2 (2.9) 81.7 (7.0) OGLE LMC-ECL-18316 89.70 (0.47) 17000 (fixed) 16256 (190) 62.5 (1.3) 35.2 (1.1) 2.3 (1.4) 0.226 (3) 0.171 (3) 5001.7243 (80) 2.1080445 (202) 0.166 (30) 103.1 (5.1) 24.1 (3.8) OGLE LMC-ECL-18355 79.65 (0.58) 21000 (fixed) 12642 (509) 44.0 (1.6) 7.6 (0.8) 48.4 (3.2) 0.233 (4) 0.139 (9) 5002.0211 (41) 2.1675189 (126) 0.141 (19) 250.0 (4.2) 45.1 (9.9) OGLE LMC-ECL-18371 81.36 (0.25) 14000 (fixed) 14885 (197) 36.9 (0.6) 63.1 (0.6) 0 0.186 (3) 0.234 (4) 5001.9229 (24) 1.7069521 (25) 0.056 (11) 91.0 (3.6) 48.6 (18.7) OGLE LMC-ECL-18408 81.27 (0.19) 10600 (fixed) 11018 (162) 47.8 (0.3) 52.2 (0.3) 0 0.157 (2) 0.159 (2) 4002.5205 (85) 2.3382018 (253) 0.151 (52) 137.1 (14.9) 142.2 (72.6) OGLE LMC-ECL-18500 82.08 (0.25) 14500 (fixed) 14602 (208) 47.9 (0.3) 52.1 (0.4) 0 0.199 (3) 0.207 (4) 5002.2085 (63) 2.3546062 (110) 0.166 (46) 79.6 (21.0) 151.7 (77.8) OGLE LMC-ECL-18501 85.26 (0.33) 13000 (fixed) 15439 (457) 40.0 (2.2) 53.5 (3.2) 6.5 (2.7) 0.148 (4) 0.151 (4) 5002.6321 (87) 2.3935782 (121) 0.290 (109) 97.0 (11.5) 149.2 (82.0) OGLE LMC-ECL-18579 80.73 (0.44) 14500 (fixed) 12708 (346) 63.1 (2.4) 32.3 (4.0) 4.6 (1.1) 0.163 (3) 0.130 (7) 4002.1199 (160) 3.1174213 (199) 0.301 (43) 145.8 (7.3) 105.6 (16.1) OGLE LMC-ECL-19095 81.90 (0.17) 24500 (fixed) 30371 (232) 39.7 (0.6) 58.5 (1.3) 1.8 (0.8) 0.169 (2) 0.170 (3) 4002.1948 (151) 2.9751066 (81) 0.249 (94) 126.5 (13.4) 103.7 (22.3) OGLE LMC-ECL-19294 84.00 (0.30) 18500 (fixed) 8067 (169) 70.7 (1.2) 29.3 (1.0) 0 0.220 (3) 0.172 (3) 4003.8965 (82) 2.7363868 (138) 0.148 (27) 245.6 (6.1) 100.2 (7.5) OGLE LMC-ECL-19577 73.06 (0.22) 20600 (fixed) 22170 (214) 35.7 (0.6) 64.3 (0.7) 0 0.220 (2) 0.277 (3) 3006.7611 (13) 1.6514537 (16) 0.051 (4) 204.5 (7.0) 12.8 (1.0) OGLE LMC-ECL-19583 85.91 (0.42) 24500 (fixed) 20917 (351) 50.2 (2.0) 38.4 (1.6) 11.4 (2.5) 0.175 (3) 0.173 (3) 4002.6050 (118) 2.1894745 (130) 0.212 (18) 218.2 (5.2) 99.0 (8.2) OGLE LMC-ECL-19624 81.27 (0.33) 26000 (fixed) 24418 (217) 59.3 (1.7) 40.7 (1.9) 0 0.193 (3) 0.164 (2) 3002.2117 (155) 2.7015912 (227) 0.279 (25) 40.9 (3.0) 50.9 (4.2) OGLE LMC-ECL-19675 89.54 (0.59) 12500 (fixed) 12103 (260) 50.7 (1.2) 48.1 (0.8) 1.2 (1.1) 0.178 (4) 0.178 (4) 4003.1777 (53) 2.7038366 (203) 0.149 (61) 108.1 (4.7) 172.5 (19.4) OGLE LMC-ECL-19727 84.50 (0.16) 12500 (fixed) 18828 (370) 26.2 (0.7) 73.7 (0.9) 0 0.129 (2) 0.160 (3) 3007.0991 (71) 2.6668363 (215) 0.350 (110) 77.9 (8.3) 158.8 (45.1) OGLE LMC-ECL-19879 86.96 (0.48) 29000 (fixed) 28978 (305) 49.3 (0.9) 37.4 (1.5) 13.2 (3.0) 0.187 (2) 0.166 (6) 2282.2391 (127) 3.8818771 (278) 0.219 (19) 96.3 (6.6) 103.4 (16.7) OGLE LMC-ECL-20053 75.59 (0.63) 20600 (fixed) 20207 (193) 47.9 (1.1) 41.2 (0.8) 10.9 (2.4) 0.234 (7) 0.219 (5) 4002.0741 (125) 1.9068881 (22) 0.038 (11) 80.2 (2.9) 25.0 (1.9) OGLE LMC-ECL-20066 83.01 (0.26) 17000 (fixed) 12812 (166) 65.7 (0.6) 34.3 (0.4) 0 0.188 (5) 0.161 (5) 5004.1508 (81) 2.4753628 (198) 0.209 (38) 269.7 (4.3) 50.9 (18.8) OGLE LMC-ECL-20285 84.78 (0.17) 10000 (fixed) 9496 (111) 51.3 (1.8) 48.7 (1.6) 0 0.249 (2) 0.246 (2) 4001.6069 (15) 1.7624139 (33) 0.031 (8) 91.9 (1.7) 17.5 (1.5) OGLE LMC-ECL-20299 79.80 (0.25) 31500 (fixed) 32385 (136) 42.7 (0.4) 46.8 (0.9) 10.5 (1.5) 0.210 (3) 0.216 (2) 4002.8032 (23) 2.8414568 (43) 0.053 (7) 48.9 (2.2) 41.4 (5.0) OGLE LMC-ECL-20384 83.55 (0.48) 26000 (fixed) 15442 (242) 84.5 (1.1) 15.5 (1.0) 0 0.222 (2) 0.147 (1) 4001.1584 (72) 2.4038316 (129) 0.165 (10) 196.7 (4.1) 54.6 (4.8) OGLE LMC-ECL-20550 88.83 (0.69) 13000 (fixed) 12758 (138) 55.1 (1.8) 42.5 (3.1) 2.4 (2.4) 0.249 (6) 0.224 (4) 4000.8871 (10) 1.4474212 (5) 0.040 (5) 347.8 (1.0) 13.4 (1.2) OGLE LMC-ECL-20589 83.75 (0.21) 26000 (fixed) 24274 (226) 54.2 (0.7) 45.8 (0.5) 0 0.195 (3) 0.190 (2) 2926.6720 (133) 3.8535274 (326) 0.195 (33) 207.1 (9.9) 108.8 (4.5) OGLE LMC-ECL-20648 82.60 (0.15) 17500 (fixed) 18913 (230) 42.3 (0.6) 57.6 (0.8) 0 0.169 (3) 0.186 (3) 4002.2779 (131) 2.5286693 (35) 0.241 (12) 196.5 (7.6) 67.5 (8.2) OGLE LMC-ECL-20735 83.37 (0.40) 9500 (fixed) 9167 (175) 55.6 (0.4) 44.4 (0.3) 0 0.223 (5) 0.208 (3) 4003.5952 (18) 1.7966394 (23) 0.049 (16) 57.0 (2.4) 58.6 (4.0) OGLE LMC-ECL-20783 87.99 (0.17) 24000 (fixed) 24253 (120) 46.7 (0.6) 52.3 (0.5) 1.0 (1.0) 0.236 (2) 0.248 (3) 9184.2211 (70) 3.2566811 (80) 0.082 (13) 319.5 (3.5) 60.2 (6.1) OGLE LMC-ECL-20860 83.87 (0.85) 17000 (fixed) 13737 (191) 33.7 (1.8) 20.9 (2.4) 45.4 (5.6) 0.229 (7) 0.210 (5) 4002.8836 (27) 1.6441828 (33) 0.049 (11) 253.8 (2.2) 22.1 (2.3) OGLE LMC-ECL-21259 80.40 (0.76) 25500 (fixed) 13838 (334) 54.0 (3.2) 9.1 (2.7) 36.9 (6.1) 0.235 (4) 0.155 (6) 4001.1459 (78) 2.5508208 (251) 0.133 (30) 229.3 (6.0) 73.6 (23.4) OGLE LMC-ECL-21278 86.90 (0.99) 26000 (fixed) 19842 (342) 62.6 (2.5) 20.7 (0.8) 16.7 (3.7) 0.255 (6) 0.178 (3) 4002.6536 (13) 1.6617552 (27) 0.039 (5) 77.1 (2.6) 31.1 (7.2) OGLE LMC-ECL-21479 79.09 (0.60) 10400 (fixed) 8006 (207) 69.9 (2.4) 30.1 (2.2) 0 0.211 (6) 0.182 (9) 5550.6183 (99) 2.0602435 (244) 0.177 (41) 160.3 (7.1) 37.7 (8.5) OGLE LMC-ECL-21647 74.07 (0.21) 17000 (fixed) 17390 (156) 48.9 (0.4) 51.1 (0.4) 0 0.221 (3) 0.221 (3) 4001.3485 (36) 2.6411620 (79) 0.084 (20) 127.6 (4.5) 77.3 (8.7) OGLE LMC-ECL-21695 81.88 (0.18) 17000 (fixed) 14154 (121) 57.8 (1.0) 42.2 (0.9) 0 0.177 (2) 0.171 (3) 4001.6820 (122) 2.7611224 (396) 0.200 (45) 227.1 (8.4) 154.4 (15.2) OGLE LMC-ECL-21961 89.74 (0.37) 16000 (fixed) 14973 (218) 56.4 (0.3) 43.6 (0.3) 0 0.194 (2) 0.179 (2) 4001.0849 (42) 2.0607986 (98) 0.096 (6) 296.4 (3.2) 74.3 (5.7) OGLE LMC-ECL-21968 75.48 (0.71) 24500 (fixed) 29213 (315) 27.9 (0.9) 60.0 (1.3) 12.1 (1.8) 0.175 (3) 0.218 (5) 4001.6143 (31) 2.8824655 (130) 0.150 (52) 79.6 (6.2) 69.6 (30.9) OGLE LMC-ECL-22069 86.52 (0.27) 31500 (fixed) 29685 (276) 52.9 (1.2) 44.7 (1.4) 2.4 (1.3) 0.174 (4) 0.170 (2) 4000.7189 (49) 2.2719812 (159) 0.210 (31) 135.6 (3.3) 78.1 (15.8) OGLE LMC-ECL-22211 80.34 (0.40) 16000 (fixed) 13995 (295) 58.1 (0.8) 41.9 (0.8) 0 0.244 (2) 0.228 (3) 4000.8583 (19) 1.3846511 (18) 0.043 (4) 275.8 (1.8) 17.3 (2.0) OGLE LMC-ECL-22232 80.29 (0.48) 20600 (fixed) 19708 (149) 54.8 (1.4) 30.2 (0.9) 15.0 (3.2) 0.228 (4) 0.176 (3) 4000.7192 (36) 2.0099807 (57) 0.090 (25) 323.2 (4.5) 36.2 (6.6) OGLE LMC-ECL-22422 85.19 (0.36) 13500 (fixed) 12558 (220) 52.4 (1.1) 47.6 (1.0) 0 0.216 (3) 0.218 (3) 4001.2210 (20) 1.5616800 (46) 0.069 (18) 45.5 (6.1) 43.0 (11.3) OGLE LMC-ECL-22455 79.54 (0.49) 20600 (fixed) 23856 (478) 22.1 (0.7) 34.8 (0.6) 43.1 (4.5) 0.172 (3) 0.192 (7) 4000.1400 (22) 1.9563996 (37) 0.159 (41) 101.2 (3.2) 67.0 (13.1) OGLE LMC-ECL-22494 83.08 (0.42) 14000 (fixed) 14492 (298) 41.8 (0.6) 57.8 (0.5) 0.4 (0.4) 0.199 (4) 0.229 (6) 4001.3256 (13) 1.3164150 (14) 0.064 (8) 256.6 (1.9) 45.9 (8.2) OGLE LMC-ECL-22613 75.84 (0.53) 30000 (fixed) 26863 (303) 46.8 (1.0) 25.1 (2.1) 28.1 (2.8) 0.281 (4) 0.232 (6) 4000.2078 (21) 1.7859888 (32) 0.010 (3) 70.9 (2.8) 6.6 (0.3) OGLE LMC-ECL-22695 78.20 (0.18) 22000 (fixed) 22550 (127) 43.2 (0.5) 56.8 (0.5) 0 0.204 (2) 0.229 (2) 4002.2386 (23) 2.3403132 (41) 0.050 (9) 105.5 (3.4) 37.8 (7.5) OGLE LMC-ECL-23298 76.82 (0.29) 26000 (fixed) 22947 (311) 41.0 (1.2) 31.4 (0.8) 27.6 (3.1) 0.278 (5) 0.272 (5) 4000.8389 (12) 1.9329663 (13) 0.012 (4) 63.6 (1.3) 12.2 (0.9) OGLE LMC-ECL-23323 80.96 (0.35) 15700 (fixed) 11814 (143) 56.1 (0.9) 36.2 (0.6) 7.7 (1.9) 0.237 (3) 0.236 (3) 4001.0205 (13) 1.3528091 (19) 0.034 (10) 275.9 (3.2) 20.1 (6.7) OGLE LMC-ECL-23920 81.51 (0.48) 17800 (fixed) 13018 (286) 46.5 (1.7) 24.6 (1.0) 28.9 (3.2) 0.226 (6) 0.210 (5) 4001.1443 (29) 1.8619509 (71) 0.083 (17) 92.5 (4.0) 46.6 (14.9) OGLE LMC-ECL-24112 76.95 (0.29) 15700 (fixed) 19418 (400) 24.3 (1.1) 49.1 (1.5) 26.6 (2.0) 0.176 (3) 0.214 (5) 5002.0329 (71) 3.5598499 (180) 0.150 (42) 120.4 (5.5) 126.4 (32.6) OGLE LMC-ECL-24236 79.67 (0.37) 15000 (fixed) 10398 (328) 57.4 (2.3) 14.0 (1.2) 28.6 (1.7) 0.230 (3) 0.164 (3) 5002.4655 (34) 1.6278800 (85) 0.118 (38) 250.1 (3.7) 55.2 (14.8) OGLE LMC-ECL-24534 89.75 (0.19) 29000 (fixed) 26600 (129) 60.8 (0.3) 39.2 (0.3) 0 0.210 (3) 0.183 (2) 5000.8369 (20) 2.4958955 (64) 0.094 (31) 82.5 (1.9) 60.6 (19.0) OGLE LMC-ECL-24817 84.16 (0.46) 11000 (fixed) 11671 (206) 43.7 (2.2) 51.2 (1.6) 5.1 (1.9) 0.184 (5) 0.191 (3) 5002.1038 (77) 2.1453406 (172) 0.165 (48) 129.7 (6.4) 107.2 (42.1) OGLE LMC-ECL-25047 86.08 (0.49) 20600 (fixed) 20516 (317) 55.3 (3.0) 38.9 (2.1) 5.8 (3.2) 0.268 (4) 0.208 (7) 5000.6412 (10) 1.0137603 (11) 0.049 (12) 5.8 (2.1) 10.8 (1.5) OGLE LMC-ECL-25227 85.50 (0.30) 17000 (fixed) 14237 (299) 68.1 (0.5) 31.9 (0.5) 0 0.206 (3) 0.160 (3) 5002.3763 (59) 1.9394433 (92) 0.168 (29) 257.0 (4.0) 78.9 (7.2) OGLE LMC-ECL-25743 83.61 (0.17) 26000 (fixed) 25326 (105) 54.5 (0.6) 45.5 (0.4) 0 0.252 (3) 0.241 (3) 5000.9462 (62) 3.8107354 (320) 0.111 (38) 114.1 (4.8) 83.6 (12.9) OGLE LMC-ECL-25885 85.69 (0.22) 10000 (fixed) 10186 (156) 49.0 (0.4) 51.0 (0.4) 0 0.199 (3) 0.201 (4) 5001.3961 (45) 3.2780824 (129) 0.193 (77) 103.9 (11.2) 156.9 (29.8) OGLE LMC-ECL-25980 81.58 (0.41) 17000 (fixed) 15824 (120) 55.6 (1.1) 42.2 (0.9) 2.2 (1.7) 0.262 (3) 0.239 (5) 5001.8010 (10) 1.7887515 (28) 0.028 (3) 83.4 (3.9) 30.8 (4.5)

Article number, page 22 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Table A.5. Third-body orbit parameters of the individual systems.

System A ω_3 P_3 T_0 [HJD] e_3 f (m_3) P^2/P_3 P^2_3/P [days] [deg] [yr] (2400000+) [M_⊙] [days] [yr]

OGLE LMC-ECL-00483 0.0101 (23) 186.9 (15.1) 16.3 (1.7) 50041 (5400) 0.464 (96) 0.029 (10) 0.0006377 50364 OGLE LMC-ECL-00737 0.0055 (17) 150.0 (18.0) 8.7 (1.1) 51660 (1809) 0.449 (21) 0.014 (3) 0.0012394 13951 OGLE LMC-ECL-02912 0.0054 (12) 76.1 (11.4) 7.9 (1.3) 59187 (239) 0.484 (57) 0.014 (3) 0.0015495 10722 OGLE LMC-ECL-07578 0.0051 (7) 61.6 (12.3) 43.4 (7.4) 51528 (481) 0.450 (103) 0.390 (89) 0.0010190 171095 OGLE LMC-ECL-10302 0.0058 (4) 148.2 (22.1) 6.5 (0.3) 66252 (164) 0.079 (26) 0.025 (2) 0.0010042 9917 OGLE LMC-ECL-11351 0.0121 (9) 244.4 (14.9) 8.7 (0.5) 67153 (872) 0.080 (30) 0.122 (23) 0.0018351 11390 OGLE LMC-ECL-11854 0.0061 (14) 18.1 (23.7) 16.3 (6.6) 57787 (1289) 0.669 (134) 0.010 (24) 0.0009691 40305 OGLE LMC-ECL-12043 0.0114 (18) 130.4 (16.0) 6.1 (0.9) 65487 (578) 0.121 (112) 0.207 (17) 0.0008039 10268 OGLE LMC-ECL-12504 0.0042 (17) 129.1 (24.8) 7.7 (4.0) 55933 (1302) 0.114 (88) 0.006 (4) 0.0020258 9077 OGLE LMC-ECL-12792 0.0138 (24) 26.5 (20.0) 18.7 (1.3) 53958 (375) 0.087 (43) 0.039 (3) 0.0004409 73625 OGLE LMC-ECL-15161 0.0035 (16) 71.4 (18.6) 7.2 (0.8) 65075 (1235) 0.061 (89) 0.004 (2) 0.0050121 5193 OGLE LMC-ECL-15288 0.0065 (10) 256.5 (31.8) 14.2 (3.0) 67590 (772) 0.051 (11) 0.007 (2) 0.0013768 27628 OGLE LMC-ECL-15473 0.0055 (9) 179.4 (10.5) 3.6 (0.2) 65832 (198) 0.077 (23) 0.066 (11) 0.0019212 2977 OGLE LMC-ECL-15664 0.0244 (11) 158.1 (8.2) 4.9 (0.3) 58687 (240) 0.431 (20) 4.123 (127) 0.0018504 4812 OGLE LMC-ECL-15779 0.0118 (23) 192.8 (32.8) 3.4 (0.9) 58062 (181) 0.001 (13) 0.733 (86) 0.0050449 1688 OGLE LMC-ECL-16320 0.0118 (12) 170.1 (7.4) 20.1 (1.3) 62128 (523) 0.372 (82) 0.027 (6) 0.0006066 69760 OGLE LMC-ECL-16414 0.0199 (16) 28.8 (18.2) 12.8 (2.5) 69372 (526) 0.069 (14) 0.252 (72) 0.0010706 26940 OGLE LMC-ECL-16928 0.0108 (24) 94.3 (11.1) 16.6 (4.1) 67522 (820) 0.094 (32) 0.024 (18) 0.0013116 35643 OGLE LMC-ECL-17183 0.0060 (9) 166.3 (10.9) 10.1 (2.7) 67869 (533) 0.069 (13) 0.011 (5) 0.0013146 17029 OGLE LMC-ECL-17198 0.0102 (17) 191.3 (8.4) 2.9 (0.3) 89367 (114) 0.599 (65) 1.218 (79) 0.0100834 959 OGLE LMC-ECL-17236 0.0079 (10) 305.5 (15.2) 8.4 (3.7) 49564 (1270) 0.317 (115) 0.037 (12) 0.0008057 16493 OGLE LMC-ECL-17267 0.0517 (110) 300.3 (20.1) 42.9 (8.9) 85049 (1431) 0.749 (143) 0.490 (139) 0.0002257 357586 OGLE LMC-ECL-17498 0.0042 (9) 209.4 (16.0) 10.2 (2.2) 65941 (418) 0.188 (72) 0.004 (1) 0.0018049 14573 OGLE LMC-ECL-17579 0.0193 (22) 56.8 (17.4) 7.8 (0.6) 65679 (172) 0.187 (14) 0.631 (19) 0.0008424 14321 OGLE LMC-ECL-17774 0.0409 (26) 10.4 (10.2) 11.1 (1.1) 52695 (370) 0.378 (72) 3.605 (82) 0.0037569 11456 OGLE LMC-ECL-17800 0.0055 (11) 251.4 (32.7) 14.8 (2.4) 67039 (696) 0.203 (83) 0.004 (2) 0.0003806 55890 OGLE LMC-ECL-18355 0.0118 (16) 359.9 (11.6) 4.9 (1.0) 64531 (389) 0.226 (68) 0.392 (90) 0.0026393 4002 OGLE LMC-ECL-18579 0.0062 (23) 194.6 (22.5) 9.3 (1.8) 63356 (665) 0.211 (110) 0.016 (9) 0.0028625 10123 OGLE LMC-ECL-19583 0.0057 (17) 358.3 (10.1) 7.9 (1.1) 64448 (402) 0.126 (60) 0.016 (3) 0.0016531 10515 OGLE LMC-ECL-19879 0.0096 (8) 253.3 (8.9) 7.0 (0.5) 58977 (211) 0.747 (101) 0.101 (66) 0.0056815 4629 OGLE LMC-ECL-20053 0.0033 (11) 236.1 (21.8) 5.6 (1.0) 67592 (326) 0.209 (93) 0.006 (3) 0.0017783 6003 OGLE LMC-ECL-20299 0.0039 (7) 112.3 (10.4) 9.7 (1.6) 63550 (501) 0.141 (76) 0.003 (2) 0.0022804 12180 OGLE LMC-ECL-20860 0.0437 (9) 1.4 (8.5) 19.7 (0.8) 63450 (234) 0.107 (13) 1.143 (15) 0.0003763 85949 OGLE LMC-ECL-21968 0.0063 (11) 355.7 (12.8) 3.7 (0.7) 54143 (290) 0.750 (109) 0.322 (77) 0.0060234 1762 OGLE LMC-ECL-22232 0.0049 (8) 3.7 (13.0) 8.8 (1.6) 55716 (498) 0.749 (152) 0.027 (11) 0.0012493 14245 OGLE LMC-ECL-22613 0.0449 (12) 189.2 (3.7) 23.5 (0.4) 57134 (141) 0.521 (21) 1.344 (48) 0.0003709 113408

Article number, page 23 of 25

Fig. 14. Histogram of orbital periods of the analysed systems.

Fig. 15. Diagram showing apsidal motion period vs orbital period.

Fig. 16. Histogram of relative radii of all systems for both eclipsing components.

Fig. 17. Plot showing the distribution of eccentricities vs orbital periods for eclipsing binaries. The red dots are our new data from the present paper, which are being compared with the other LMC/SMC systems. The blue dots are taken from our previous analyses, and the cyan dots are taken from publications by Hong et al. (see Table in Section 1 for reference). A comparison with galactic eclipsing binaries as published in the catalogue of Kim et al. (2018) are plotted in black. Circularisation in shorter periods is clearly visible here.

Article number, page 24 of 25

Zasche et al.: Study of 162 LMC eccentric eclipsing binaries

Fig. 18. Plot of the O − C diagrams after subtraction of apsidal motion fits for cases where there appears to be some variation of residuals, but it is still rather questionable. More data are needed.

Article number, page 25 of 25