arXiv:1712.05863v1 [astro-ph.SR] 15 Dec 2017

Draft version December 22, 2017 Preprint typeset using L^ATEX style AASTeX6 v. 1.0

HR 8844: A NEW TRANSITION OBJECT BETWEEN THE AM STARS AND THE HGMN STARS ?

R. Monier^1 LESIA, UMR 8109, Observatoire de Paris et Université Pierre et Marie Curie Sorbonne Universités, place J. Janssen, Meudon.

M. Gebran^2 Department of Physics and Astronomy, Notre Dame University-Louaize, PO Box 72, Zouk Mikael, Lebanon.

F. Royer^3 GEPI, Observatoire de Paris, place J. Janssen, Meudon, France.

T. Kilicoglu^4 Department of Astronomy and Space Sciences, Faculty of Science, Ankara University, 06100, Turkey.

Y. Frémat^5 Royal observatory of Belgium, Dept. Astronomy and Astrophysics, Brussels, 8510, Belgium.

ABSTRACT While monitoring a sample of apparently slowly rotating superficially normal early A stars, we have discovered that HR 8844 (A0 V), is actually a new Chemically Peculiar star. We have first compared the high resolution spectrum of HR 8844 to that of four slow rotators near A0V (ν Cap, ν Cnc , Sirius A and HD 72660) to highlight similarities and differences. The lines of Ti II, Cr II, Sr II and Ba II are conspicuous features in the high resolution high signal-to-noise SOPHIE spectra of HR 8844 and much stronger than in the spectra of the normal star ν Cap. The Hg II line at 3983.93 Å is also present in a 3.5 % blend. Selected unblended lines of 31 chemical elements from He up to Hg have been synthesized using model atmospheres computed with ATLAS9 and the spectrum synthesis code SYNSPEC48 including hyperfine structure of various isotopes when relevant. These synthetic spectra have been adjusted to the mean SOPHIE spectrum of HR 8844, and high resolution spectra of the comparison stars. Chisquares were minimized in order to derive abundances or upper limits to the abundances of these elements for HR 8844 and the comparison stars. HR 8844 is found to have underabundances of He, C, O, Mg, Ca and Sc, mild enhancements of Ti, V, Cr, Mn and distinct enhancements of the heavy elements Sr, Y, Zr, Ba, La, Pr, Sm, Eu and Hg, the overabundances increasing steadily with atomic number. This chemical pattern suggests that HR 8844 may actually be a new transition object between the coolest HgMn stars and the Am stars. Keywords: stars: early-type – stars: abundances – stars: Chemically Peculiar

1. INTRODUCTION A bibliographic query of the CDS for HR 8844 actually reveals only 34 publications. HR 8844 appears in Cowley et al.’s classification of the bright A stars and was ascribed an A0V spectral type by these authors. They did not comment on any peculiarity of the spectrum. HR 8844 is also in Eggen’s survey of A0 stars (Eggen 1984). It appears as a single star in Eggleton & Tokovinin (2008). The purpose of this paper is to perform a detailed abundance analysis of HR 8844 and show that this star is a new Chemically Peculiar (CP) star.

We have recently undertaken a spectroscopic survey of all apparently slowly rotating bright early A stars (A0-A1V) and late B stars (B8-B9V) observable from the northern hemisphere. This project addresses fundamental questions of the physics of late-B and early-A stars: i) can we find new instances of rapid rotators seen pole-on (other than Vega) and study their physical properties (gradient of temperature across the disk, limb and gravity darkening), ii) is our census of Chemically Peculiar stars complete up to the magnitude limits we adopted ? If not, what are the physical properties of the newly found CP stars? The abundance results for the A0-A1V sample have been published in Royer et al. (2014). Targets have been observed with SOPHIE, the échelle high-resolution spectrograph at Observatoire de Haute Provence yielding spectra covering the 3900–6800 Å spectral range over 39 orders at a resolving power R = 75000. A careful abundance analysis of the high resolution high signal-to-noise ratio spectra of the A stars sample and a hierarchical classification have allowed to sort out the sample of 47 A stars into 17 chemically normal stars (ie. whose abundances do not depart by more than ±0.20 dex from solar values), 12 spectroscopic binaries and 13 Chemically Peculiar stars (CPs) among which five are new CP stars. The status of these new CP stars still needs to be fully specified by spectropolarimetric observations to address their magnetic nature or by exploring new spectral ranges which we had not explored in this first study.

We have now started to examine the B8-B9V sample using the full wavelength coverage provided by SOPHIE to search for new Chemically Peculiar stars. We have already reported on the discovery of 4 new HgMn stars (Monier et al. 2015) whose spectra display strong Hg II lines at 3984 Å and strong Mn II lines. In the process of our analysis of the B8-B9V sample, we also found that HD 67044 is most likely another new HgMn star (Monier et al. 2016). Royer et al. (2014) performed abundance analyses for C, O, Mg, Si, Ca, Sc, Ti, Cr, Fe, Sr, Y, Zr using Takeda’s automated procedure and classified HR 8844 as “probably normal”: the four criteria used for the automatic classification were not fully consistent, depending on the chemical species used. In order to clarify the nature of HR 8844, we have compared its spectra with high resolution high signal-to-noise spectra of 4 stars near A0V and B9V: the superficially normal ν Cap (B9V) and the cool HgMn star ν Cnc, Sirius A (A1m) and HD 72660 (A1m). We have then determined the abundances of 31 chemical elements, in particular helium and several species heavier than barium (not studied in Royer et al. 2014), for HR 8844 using spectrum synthesis to quantify the enhancements and depletions of these elements or to provide upper limits. We also performed the abundance analysis for the four comparison stars using as much as feasible the same lines and atomic data as employed for HR 8844 for consistency in order to compare the chemical composition of HR 8844 with that of these comparison stars and clarify the nature of this object.

2. OBSERVATIONS AND REDUCTION We obtained one spectrum of HR 8844 on 05 August 2009 and then secured 3 new spectra in December 2016 at Observatoire de Haute Provence using the high resolution (R = 75000) mode of the SOPHIE échelle spectrograph (Perruchot et al. 2008). The^S_N ratio of the individual spectra ranges from 251 up to 381 at 5500 Å . For ν Cap, we secured four high resolution spectra with HERMES (Raskin et al. 2011) at the Roque de los Muchachos Observatory. For the three other comparison stars, we fetched spectra from spectroscopic archives. For HD 72660, we fetched a spectrum from the HARPS archive (R=125000) and for Sirius A several I profiles obtained with NARVAL from the the Polarbase database (R=75000). For ν Cnc, we have retrieved a spectrum form the ELODIE archive (R=45000). The observations log of these data for the 5 stars is displayed in Table 1.

The SOPHIE, ELODIE, HARPS, NARVAL and HERMES data are automatically reduced by the individual projects to produce 1D extracted and wavelength calibrated échelle orders. Each reduced order was normalised separately using a Chebychev polynomial fit with sigma clipping, rejecting points above or below 1 σ of the local continuum. Normalized orders were then merged together, corrected by the blaze function and resampled into a constant wavelength step of about 0.02 Å (see Royer et al. 2014, for more details). The radial velocity of HR 8844, ν Cap and HD 72660 were derived in Royer et al. (2014) using cross-correlation techniques, avoiding the Balmer lines and the atmospheric telluric lines. The normalized spectrum was cross-correlated with a synthetic template extracted from the POLLUX database^1 (Palacios et al. 2010) corresponding to the parameters T_{eff} = 11000 K, log g = 4 and solar abundances. A parabolic fit of the upper part of the resulting cross-correlation function yields the Doppler shift, which is then used to shift spectra to rest wavelengths. The projected rotational velocities are taken from Royer et al. (2014) who derived them from the position of the first zero of the Fourier transform of individual lines. The radial velocity and projected equatorial velocity of HR 8844, ν Cap, HD 72660, ν Cap and ν Cnc are collected in Table 2. For Sirius A, they were retrieved from Landstreet (2011).

3. THE LINE SPECTRUM OF HR 8844 - COMPARISON TO ν CAP

1 http://pollux.graal.univ-montp2.fr

Table 1. Observation log for HR 8844, Vega, ν Cap, ν Cnc, Sirius A and HD72660

Star ID Spectral V Observation Instrument Resolving Exposure S/N S/N S/N type Date power time (s ) at 3900 Å at 5000 Å at 6000 Å HR 8844 A0V 5.89 2009-08-05 SOPHIE 75000 600 143 269 274 HR 8844 A0V 5.89 2016-12-12 SOPHIE 75000 900 202 381 389 HR 8844 A0V 5.89 2016-12-13 SOPHIE 75000 400 133 251 256 HR 8844 A0V 5.89 2016-12-14 SOPHIE 75000 600 174 328 335 Vega A0V 0.00 2012-08-06 SOPHIE 75000 25 309 583 595 ν Cap B9IV 4.76 2014-08-16 HERMES 85000 150 85 160 163 ν Cap B9IV 4.76 2014-08-16 HERMES 85000 150 54 102 104 ν Cap B9IV 4.76 2014-08-16 HERMES 85000 150 87 164 167 ν Cap B9IV 4.76 2014-08-16 HERMES 85000 150 80 150 153 ν Cnc B9.5VHgMn 5.45 2005-02-05 ELODIE 42000 3600 182 344 350 Sirius A A1Vm -1.46 2007-03-12 NARVAL 75000 2 239 450 459 HD 72660 A0Vm 5.80 2012-02-19 HARPS 125000 117.8 77 146 149

3.1. The line spectrum of HR 8844 In order to establish the chemical peculiarity of HR 8844, we have measured the centroids of all 552 lines absorbing more than 2% of the continuum. Almost all these lines could be identified after we performed a complete synthesis of the spectrum and derived the abundances. The proposed identifications corresponding to the final abundances of HR 8844 are collected in Table 3. The strongest lines (ie. which absorb more than 5% of the continuum) are due to Mg II, Mg I, Ca II (resonance lines), Ca I (idem), Ti II, Cr II, Fe II, Fe I, Sr II and Ba II. Several spectral regions have been inspected to search for the chemical peculiarity of HR 8844. First, the red wing of Hϵ, harbors a line close to the location of the Hg II λ 3983.93 Å line and several Zr II and Y II lines likely to be strengthened in CP stars. After proper correction for the stellar radial velocity, we found that HR 8844 does show a feature next to the Hg II 3983.93 Å line absorbing about 3.5 % , and also the lines of Y II at 3982.59 Å (2 %) and of Zr II at 3991.13 Å (3.5 %) and 3998.97 Å (2 %). Several other lines of Y II and Zr II could be identified in the spectrum of HR 8844 and have been used to derive the abundances of these elements. Second, we examined the region from 4125 Å to 4145 Å for the Si II lines at 4128.054 Å and 4130.894 Å and the Mn II line at 4136.92 Å. This Mn II line is definitely present in HR 8844 but is only a weak line (0.5 %). Similarly, the lines of Mn II at 4206.37 Å and 4252.96 Å absorb respectively 1.5 % and 2.0 %. The abundance analysis of two Mn II lines with hyperfine structure will reveal a manganese excess of about 2 times the solar value.

3.2. Comparison to spectra of ν Cap HR 8844, Vega and ν Cap have similar effective temperatures, surface gravities and projected equatorial velocities v_e sin i. Differences in the line intensities should therefore reflect mostly differences in chemical compositions. Several spectral regions highlight the differences between HR 8844 and ν Cap. Several lines are stronger in HR 8844 than in ν Cap and Vega which shows than HR 8844 is enriched in the elements responsible for these lines with respect to ν Cap and Vega . We will only show the comparisons with ν Cap here. Figure 1 displays the comparison of the spectra of ν Cap and HR 8844 in the range from 4930 Å to 4940 Å where three lines of C I and the resonance line of Ba II at 4934.096 Å fall. All lines of C I are slightly stronger and the Ba II line is much stronger in HR 8844. Figure 2 displays the comparison of the spectra of ν Cap and HR 8844 in the range 6140 to 6160 Å where several lines of O I fall together with the Fe II lines at 6147.62 Å and 6149.26 Å and the Ba II line at 6141.713 Å. All O I lines are weaker in HR 8844 whereas the Ba II line is much stronger in HR 8844. Figure 3 displays the comparison of the spectra of ν Cap and HR 8844 in the range 4300 to 4320 Å where 4 Ti II lines, the Sc II line at 4314.18 Å and the Sr II line at 4305.443 Å fall. The lines of Ti II, Sc II and Sr II are all stronger in the spectrum of HR 8844 than in that of ν Cap. Figure 4 displays the comparison of the spectra of ν Cap and HR 8844 in the range 4060 Å up to 4080 Å where the Ni II at 4067.04 Å and the Sr II resonance line at 4077.70 Å fall. These two lines are stronger in the spectrum of HR 8844 than in that of ν Cap. Finally, Fig. 5 displays the comparison of the SOPHIE spectra of ν Cap and HR 8844 in the range 4260 up to 4280 Å where the C II doublet at 4267.00 Å and 4267.26 Å and the Cr II lines at 4261.92 Å and 4275.56 Å fall. The C II lines are weaker in HR 8844 than in ν Cap and the Cr II lines are slightly stronger in HR 8844. From these first comparisons, we infer that C, O should be less abundant in HR 8844 than in ν Cap, whereas

Fe may be comparable and Ti, Cr, Ni, Sr and Ba are more abundant in HR 8844 than in ν Cap. Similar trends are found when comparing the spectra of Vega and HR 8844. The abundance analysis carried out in next paragraph will confirm this.

Figure 1. Comparison of the C I lines and the Ba II resonance line at 4934.076 Å in the spectra of ν Cap (solid line) and HR 8844 (dashed lines)

Figure 2. Comparison of the O I lines at 6155.87, 6156.62 and 6158.17 Å, the Ba II line at 6141.713 Å in the spectra of ν Cap (solid line) and HR 8844 (dashed lines)

4. ABUNDANCE DETERMINATIONS FOR HR 8844, ν CAP, ν CNC, SIRIUS A AND HD 72660 4.1. Fundamental parameters determinations For HR 8844 , ν Cap and ν Cnc, we have applied Napiwotzky’s (1993) UVBYBETA procedure to derive the effective temperature and surface gravity. The fundamental parameters of Sirius A and HD 72660 were taken respectively from Landstreet (2011) and Golriz & Landstreet (2016). The adopted effective temperatures, surface gravities, projected equatorial velocities and radial velocities for HR 8844, V ega, ν Cap, ν Cnc, Sirius A and HD 72660 are collected in Table 2. The adopted values for the parameters of HR8844 are in good agreement with the spectroscopic determination of Gebran et al. (2016). The projected equatorial velocities and radial velocities of HR 8844 and HD 72660 are taken from Royer et al. (2014) and for ν Cap from Royer et al. (2002).

4.2. Microturbulent velocity determination

Figure 3. Comparison of four Ti II lines, the Sr II line at 4305.443 Å and the Sc II line at 4314.18 Å in the spectra of ν Cap (solid line) and HR 8844 (dashed lines)

Figure 4. Comparison of the Ni II lines at 4067.04 Å, the Sr II resonance line at 4077.70 Å in the spectra of ν Cap (solid line) and HR 8844 (dashed lines)

Figure 5. Comparison of the C II doublet at 4267.00 and 4267.26 Å and the Cr II lines at 4261.92 and 4275.56 Å in the spectra of ν Cap (solid line) and HR 8844 (dashed lines)

Table 2. Adopted fundamental parameters for HR 8844, Vega, ν Cap, ν Cnc, Sirius A, HD 72660

Star ID T_{eff} log g v sin i V_{rad} ξ (K) (km s^{−1}) (km s^{−1}) (km s^{−1}) HR 8844 9752 ± 250 3.80 ± 0.25 27.3 ± 0.3 -4.48 ± 0.21 1.40 ± 0.20 Vega 9500 ± 250 4.00 ± 0.25 27.0 ± 0.3 -17.51 ± 0.02 1.70 ± 0.30 ν Cap 10300 ± 250 3.90 ± 0.25 24.0 ± 0.3 -11.39 ± 0.20 0.50 ± 0.20 ν Cnc 10300 ± 250 3.67 ± 0.25 18.0 ± 0.3 -20.04 ± 0.20 0.10 ± 0.20 Sirius A 9900 ± 250 4.30 ± 0.25 16.5 ± 0.3 variable 2.10 ± 0.30 HD 72660 9650 ± 250 4.05 ± 0.25 5.0 ± 0.5 4.50 ± 0.07 2.20 ± 0.20

In order to derive the microturbulenct velocity of HR 8844, Vega, ν Cap, ν Cnc, Sirius A and HD 72660, we have simultaneously derived the iron abundance [Fe/H] for 50 unblended Fe II lines and a set of microturbulent velocities ranging from 0.0 to 5.0 km s^{−1}. Figure 6 shows the standard deviation of the derived [Fe/H] as a function of the microturbulent velocity. The adopted microturbulent velocities are the values which minimize the standard deviations ie. for that value, all Fe II lines yield the same iron abundance. We therefore adopt a microturbulent velocity ξ_t = 1.4 ± 0.2 km s^{−1} constant with depth for HR 8844. The microturbulent velocities of the six stars are collected in Table 2.

Figure 6. Determination of the microturbulent velocities of HR 8844, Vega, ν Cap, ν Cnc, Sirius A and HD 72660.

4.3. Model atmospheres and spectrum synthesis calculations Plane parallel model atmospheres assuming radiative equilibrium and hydrostatic equilibrium were computed using the ATLAS9 code (Kurucz 1992) for the appropriate fundamental parameters of each star. The linelist was built from Kurucz’s gfall21oct16.dat^2 which includes hyperfine splitting levels. The observed wavelengths and oscillator strengths were retrieved by querying the NIST^3. For the other species which lack data in the Atomic Spectra Database, we have used other references to retrieve their atomic data which are collected in Tab. 5. A grid of synthetic spectra was computed with SYNSPEC48 (Hubeny & Lanz 1992) to model the lines of 31 elements for HR8844 and ν Cap. Computations were iterated varying the unknown abundance until minimization of the chi-square between the observed and synthetic spectrum was achieved. Abundances are derived for 34 elements for ν Cnc, 37 elements for Sirius A and 37 elements for HD 72660 because these three stars have significantly lower projected rotational velocities.

4.4. The derived abundances of HR 8844 We have used only unblended lines to derive the abundances. For a given element, the final abundance is a weighted mean of the abundances derived for each transition (the weights are derived from the NIST grade assigned to that

2 http://kurucz.harvard.edu/linelists/gfnew/gfall21oct16.dat

3 http://www.nist.gov/ Atomic Spectra Database (Kramida et al. 2017) for the following atoms or ions: He I. C II, O I, Mg II, Al I, Al II, Si II, S II, Ca II, Sc II, Ti II, Cr II, Mn II, Fe II, Sr II, Ba II and Dy II

particular transition). For several elements, in particular the heaviest elements, only one unblended line was available. These final abundances and their estimated uncertainties for HR 8844 are collected in Tab. 4. The determination of the uncertainties is discussed in the Appendix. Table 4 contains for each analysed species the adopted laboratory wavelength, logarithm of oscillator strength, its source, the logarithm of the absolute abundance normalised to that of hydrogen (on a scale where log(N_H ) = 12) for each transition, and the solar abundance adopted for that element. In this work, we adopted Grevesse & Sauval (1998) abundances for the Sun as a reference. The final mean abundance and its estimated uncertainty are then given.

The light elements, He, C , O, Mg are found to be depleted in HR 8844. The helium abundance is found to be about 0.70 times the solar abundance of helium consistently from the He I lines near 4471 Å and near 5875.5 Å. The NLTE abundance correction for the λ 4471.48 Å He I line is very small as shown by Lemke (1989) for early A-type stars and we have not corrected for it. Carbon is depleted, about 0.40 times the solar abundance from the analysis of the C II triplet at 4267 Å. Oxygen is depleted about 0.80 times the solar oxygen abundance from 12 O I transitions near 5330 Å and from 6155 to 6158 Å. Magnesium is also depleted by 0.45 times the solar abundance, aluminium is 0.8 times solar and silicon is about solar. Calcium and scandium are depleted by 0.70 times the solar abundances. As from titanium, all elements start to be mildly overabundant, except for iron. From the analysis of 12 lines, titanium is found to be about 1.41 times enriched respect to the solar abundance. The vanadium abundance is 1.88 times the solar abundance and the chromium abundance 1.45 times the solar abundance. The Mn II lines at 4206.37 Å and 4259.19 Å include hyperfine structure of the isotopes of manganese and yield 2 times the solar manganese abundance. The iron abundance which is solar has been derived mostly by using 16 Fe II lines of multiplets 37, 38 and 186 in the range 4500–4600Å whose atomic parameters are critically assessed in NIST (these are C+ and D quality lines). These lines are widely spaced and the continuum is fairly easy to trace in this spectral region. Their synthesis always yields consistent iron abundances from the various transitions with very little dispersion. The iron abundance is probably the most accurately determined of the abundances derived here. The Sr-Y-Zr triad is overabundant by modest amounts: about 5 times solar for strontium, about 5 times for yttrium and 5.8 times solar for zirconium. Barium is enhanced by a factor of 9.3 and the Lanthanides by factors of 15 up to 100 times solar. Figure 7 illustrates the detection of a 10 times solar overabundance for barium from the Ba II line at 4554.03 Å.

Figure 7. Determination of the barium overabundance from the Ba II line at 4554.03 Å in HR 8844

Mercury is enhanced by 10000 times the solar value. The overall abundance pattern of HR 8844 is therefore that light species tend to be almost all underabundant (He, C, O, Mg, Si, Ca, Sc) while the iron-peak elements show mild enhancements (less than 5 times solar) and Sr, Y, Zr, Ba, the Lanthanides and Hg show more and more pronounced overabundances (larger than 5 times solar), the largest overabundance being for Hg. The general trend therefore is that the heaviest elements are the most overabundant which strongly suggests that atomic diffusion be responsible for the chemical pattern of HR 8844.

The derived abundances of HR 8844 are compared to the previous determination in Royer et al. (2014) for the twelve elements in common in Tab. 7 and figure 8. We find a reasonably good agreement (within ± 0.25 dex) for C, O, Ca, Sc, Cr, Fe and Sr.

Figure 8. Comparison of the abundances derived in Royer et al. (2014) and this work for the twelve elements in common

4.5. The derived abundances for the comparison stars ν Cap, ν CnC, Sirius A and HD 72660 Using the same method and linelist, we have derived the elemental abundances of the normal star ν Cap, the cool HgMn star ν Cnc and the hot Am stars Sirius A and HD 72660 in order to compare the found abundances of HR 8844 to those of these four stars. The found abundances for these four comparison stars are collected in Tab. 5. We have compared the derived abundances for these four stars with published abundance studies in the literature as displayed in Tab. 7. We expect differences with previous analyses because of i) differences in the adopted v_e sin i or ξ and ii) differences in the lines used and their atomic data. The found abundances for ν Cap are very close to solar for most elements in agreement with Adelman (1991) and Smith & Dworetsky (1993). This star proves to be a very good normal comparison star. The abundances in Adelman (1991) differ slightly from ours for three reasons. Although he did use a similar effective temperature and surface gravity, Adelman adopted a null microturbulent velocity for ν Cap whereas we use 0.50 km s^{−1}. We did not necessarily use the same lines for a given element and the atomic data for the few lines have been upgraded to the latest values compiled in NIST.

For ν Cnc, our abundances are almost all larger than those reported in Adelman (1989). He did use fundamental parameters and a microturbulent velocity similar to ours, however he adopted a smaller v_e sin i= 13 km s^{−1}whereas we use 18 km s^{−1}. We therefore have to slightly enhance the abundances to reproduce the observed profiles. Note that we determine here for the first time the abundances of several Lanthanides in ν Cnc. For Sirius A, we have compared our results with the most recent determinations of Landstreet (2011) for the elements up to Nickel and Cowley et al. (2016) for heavier elements. We use the same effective temperature, surface gravity and a slightly lower microturbulent velocity (2.10 km s^{−1} rather than 2.20 km s^{−1} adopted by these authors). In his paper, Landstreet (2011) emphasizes that even for Sirius large differences in elemental abundances remain for C, Mg, Al, Si, S, Ca, V, Mn, Ni and even Fe from one author to another. We find good agreement (ie. within ± 0.20 dex) with Landstreet’s (2011) abundances for O, Ca, Cr, Mn, Fe, Ni, Sr, Ba. For elements heavier than barium, we find a fair agreement with Cowley et al. (2016) abundances for La, Pr, Nd, Sm and Hf within ± 0.20 dex of their determinations. For HD 72660, we have compared our abundances with those of Golriz & Landstreet (2016) as we have used similar effective temperature, surface gravity, projected equatorial velocity and microturbulent velocity. We find a fair agreement with Golriz & Landstreet (2016) for the abundances of several elements: C, Mg, Al, Si, S, Sc, Ti, V, Cr, Ni and Zr. In Fig. 9, we compare the found abundances for HR 8844 with our new determinations for the four comparsion stars.

Figure 9. Comparison of the abundance pattern of HR 8844, to those of ν Cap, ν Cnc, Sirius A and HD 72660.

As ν Cnc, and Sirius A , HR 8844 displays the characteristic underabundances for most elements lighter than titanium and pronounced overabundances for elements heavier which Chemically Peculiar stars harbour. The overabundances of HR 8844 are modest for the iron-peak elements but increase for the Sr-Y-Zr triad and barium (of the order of 10 times solar) and for the Lanthanides and of the order of 10^2 solar for mercury. The overabundance of manganese and mercury, the underabundances of calcium and scandium and of the lightest elements , the mild overabundances of the iron-peak elements, of the Sr-Y-Zr triad, of barium and several Rare Earths show that HR 8844 is a new hot Am star which also displays characteristic enhancements of the coolest HgMn stars (as HD 72660 and Sirius A do). We therefore propose that HR 8844 be a new transition object between the Am stars and the coolest HgMn stars and as such is a very interesting star.

5. CONCLUSION We report here on detailed abundance determinations of the A0V star HR 8844, hitherto considered as a ”normal star”. Our analysis definitely establishes that HR 8844 is a new Chemically Peculiar star, probably a hot Am star (as Sirius A and HD 72660 are) extending the realm of Am stars to significantly higher temperatures. As HD 72660 and Sirius A, HR 8844 may well be a transition object between the Am stars and the coolest HgMn star and as such is a very interesting object. We are undertaking a monitoring of HR 8844 over its rotation period (which must be smaller than 5 days assuming a radius of about 2 solar radii for an A0V star) to search for variability due to the presence of spots or a companion.

APPENDIX

A. DETERMINATION OF UNCERTAINTIES For a representative line of a given element, six major sources are included in the uncertainty determinations: the uncertainty on the effective temperature (σ_{Teff} ), on the surface gravity (σ_{log g} ), on the microturbulent velocity (σ_{ξt} ), on the apparent rotational velocity (σ_{ve sin i}), the oscillator strength (σ_{log gf} ) and the continuum placement (σ_{cont}). These uncertainties are supposed to be independent, so that the total uncertainty σ_{toti} for a given transition (i) is:

σ^2_{toti} = σ^2_{Teff} + σ^2_{log g} + σ^2_{ξt} + σ^2_{ve sin i} + σ^2_{log gf} + σ^2_{cont}. (A1)

The mean abundance < [^X_H ] > is then computed as a weighted mean of the individual abundances [X/H]_i derived for each transition (i): < [ X H ] >= ∑ i([^X_H ]_i/σ^2_{toti} ) ∑ i(1/σ^2_{toti} ) (A2) and the total error, σ is given by: 1 σ^2 = N∑ i=1 (1/σ^2_{toti} ) (A3)

where N is the number of lines per element. The uncertainties σ for each element are collected in Tab. 4.

RM thanks Pr. Charles Cowley and Pr. David Gray for their insightful comments during the analysis of HR 8844. We thank the OHP night assistants for their helpful support during the three observing runs. This work has made use of the VALD database (Ryabchikova et al. 2011), operated at Uppsala University, the Institute of Astronomy RAS in Moscow, and the University of Vienna. We have also used the NIST Atomic Spectra Database (version 5.4) available http://physics.nist.gov/asd. We also acknowledge the use of the ELODIE archive at OHP available at http://atlas.obs-hp.fr/elodie/.

REFERENCES

Adelman, S. J. 1989, MNRAS, 239, 487 Adelman, S. J. 1991, MNRAS, 252, 116 Biémont, É., Blagoev, K., Engström, L., et al. 2011, MNRAS, 414, 3350 Biemont, E., Grevesse, N., Faires, L. M., Marsden, G., & Lawler, J. E. 1989, A&A, 209, 391, (BGF) Butler, K. & Zeippen, C. J. 1991, J. Phys. IV France, 01, C1 Cowley, A., Cowley, C., Jaschek, M., & Jaschek, C. 1969, AJ, 74, 375 Cowley, C. R., Ayres, T. R., Castelli, F., et al. 2016, ApJ, 826, 158 Davidson, M. D., Snoek, L. C., Volten, H., & Doenszelmann, A.

1992, A&A, 255, 457 Den Hartog, E. A., Lawler, J. E., Sneden, C., & Cowan, J. J.

2006, ApJS, 167, 292 Dolk, L., Wahlgren, G. M., & Hubrig, S. 2003, A&A, 402, 299 Drake, G. 2006, Springer Handbook of Atomic, Molecular, and Optical Physics, ed. G. Drake (New York, NY: Springer New York), 199–219 Eggen, O. J. 1984, ApJS, 55, 597 Eggleton, P. P. & Tokovinin, A. A. 2008, MNRAS, 389, 869 Gebran, M., Farah, W., Paletou, F., Monier, R., & Watson, V.

2016, A&A, 589, A83 Golriz, S. S. & Landstreet, J. D. 2016, MNRAS, 456, 3318 Grevesse, N. & Sauval, A. J. 1998, SSRv, 85, 161 Hubeny, I. & Lanz, T. 1992, A&A, 262, 501 Kling, R., Schnabel, R., & Griesmann, U. 2001, The Astrophysical Journal Supplement Series, 134, 173 Kramida, A., Ralchenko, Y., Reader, J., & NIST ASD Team.

2017, http://physics.nist.gov/asd, 5 Kurucz, R. L. 1992, RMxAA, 23 Kurucz, R. L. 1993, (GUES) Kurucz, R. L. 2003, Robert L. Kurucz on-line database of observed and predicted atomic transitions Kurucz, R. L. 2010, Robert L. Kurucz on-line database of observed and predicted atomic transitions Kurucz, R. L. & Peytremann, E. 1975, SAO Special Report, 362, 1, (KP) Landstreet, J. D. 2011, A&A, 528, A132 Lawler, J. E., Den Hartog, E. A., Sneden, C., & Cowan, J. J.

2006, ApJS, 162, 227 Lawler, J. E., Sneden, C., & Cowan, J. J. 2004, ApJ, 604, 850 Lawler, J. E., Sneden, C., Cowan, J. J., Ivans, I. I., & Den Hartog, E. A. 2009, Astrophys. J. Suppl. Ser., 182, 51, (LSCI) Lawler, J. E., Sneden, C., Cowan, J. J., et al. 2008, ApJS, 178, 71

Lawler, J. E., Wickliffe, M. E., Cowley, C. R., & Sneden, C.

2001a, ApJS, 137, 341 Lawler, J. E., Wickliffe, M. E., den Hartog, E. A., & Sneden, C.

2001b, Astrophys. J., 563, 1075, (LWHS) Lemke, M. 1989, A&A, 225, 125 Ljung, G., Nilsson, H., Asplund, M., & Johansson, S. 2006, A&A, 456, 1181 Martin, W. C. 1960, J. Opt. Soc. Am., 50, 174 Meggers, W. F., Corliss, C. H., & Scribner, B. F. 1975a, Tables of spectral-line intensities. Part I, II - arranged by elements.

Meggers, W. F., Corliss, C. H., & Scribner, B. F. 1975b, Tables of spectral-line intensities. Part I, II - arranged by elements., ed. Meggers, W. F., Corliss, C. H., & Scribner, B. F., (MC) Miles, B. M. & Wiese, W. L. 1969, Atomic Data, 1, 1 Miller, M. H., Wilkerson, T. D., Roig, R. A., & Bengtson, R. D.

1974, PhRvA, 9, 2312, (MWRB) Monier, R., Gebran, M., & Royer, F. 2015, A&A, 577, A96 Monier, R., Gebran, M., & Royer, F. 2016, Ap&SS, 361, 139 Napiwotzki, R., Schoenberner, D., & Wenske, V. 1993, A&A, 268, 653 Palacios, A., Gebran, M., Josselin, E., et al. 2010, A&A, 516, A13 Palmeri, P., Quinet, P., Wyart, J., & Biémont, E. 2000, Physica Scripta, 61, 323, (PQWB) Perruchot, S., Kohler, D., Bouchy, F., et al. 2008, in Proc. SPIE, Vol. 7014, Ground-based and Airborne Instrumentation for Astronomy II, 70140J Pinnington, E. H., Berends, R. W., & Lumsden, M. 1995, Journal of Physics B: Atomic, Molecular and Optical Physics, 28, 2095 Raassen, A. J. J. & Uylings, P. H. M. 1998, Journal of Physics B Atomic Molecular Physics, 31, 3137 Raskin, G., van Winckel, H., Hensberge, H., et al. 2011, A&A, 526, A69 Royer, F., Gebran, M., Monier, R., et al. 2014, A&A, 562, A84 Royer, F., Grenier, S., Baylac, M.-O., Gómez, A. E., & Zorec, J.

2002, A&A, 393, 897 Ryabchikova, T., Ryabtsev, A., Kochukhov, O., & Bagnulo, S.

2006, Astron. and Astrophys., 456, 329, (RRKB) Ryabchikova, T. A., Pakhomov, Y. V., & Piskunov, N. E. 2011, Kazan Izdatel Kazanskogo Universiteta, 153, 61 Ryabtsev, A. N. 2010, private communication, (ISAN) Sansonetti, C. J. & Nave, G. 2014, The Astrophysical Journal Supplement Series, 213, 28 Sansonetti, C. J. & Reader, J. 2001, Physica Scripta, 63, 219 Shenstone, A. G. 1961, Proceedings of the Royal Society of London A: Mathematical, Physical and Engineering Sciences, 261, 153

Smith, K. C. & Dworetsky, M. M. 1993, A&A, 274, 335 Theodosiou, C. E. 1989, PhRvA, 39, 4880 Wickliffe, M. E., Lawler, J. E., & Nave, G. 2000, J. Quant.

Spectrosc. Radiat. Transfer, 66, 363, (WLN) Wiese, W. L., Fuhr, J. R., & Deters, T. M. 1996, Atomic transition probabilities of carbon, nitrogen, and oxygen : a critical data compilation

Wood, M. P., Lawler, J. E., Den Hartog, E. A., Sneden, C., & Cowan, J. J. 2014, ApJS, 214, 18 Zhiguo, Z., Li, Z. S., Lundberg, H., et al. 2000, Journal of Physics B Atomic Molecular Physics, 33, 521, (ZLLZ) Zhiguo, Z., Zhongshan, L., & Zhankui, J. 1999, The European Physical Journal D - Atomic, Molecular, Optical and Plasma Physics, 7, 499

Table 1. Line identifications for HR 8844

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

3900.55 3900.515 Fe I -0.92 26140.176 3900.55 3900.550 Ti II -0.45 9118.260 3903.08 3902.945 Fe I -0.47 12560.933 3903.99 3903.99 Fe I -2.53 34121.602 3905.58 3905.525 Si I -1.09 15394.369 3905.78 3905.644 Cr II -0.90 42986.619 3906.18 3906.035 Fe II -1.83 44929.549 3920.44 3920.26 Fe I -1.75 978.074 3922.93 3922.912 Fe I -1.65 415.933 3927.98 3927.92 Fe I -1.59 888.132

3927.925 Fe I -2.19 22838.320 3930.28 3930.296 Fe I -1.590 704.007

3930.304 Fe II -4.030 13671.086 3932.99 3932.023 Ti II -1.780 9118.260 3933.65 3933.660 Ca II 0.130 0.000 no IS comp. 3935.88 3935.813 Fe I -0.770 22838.320 3938.29 3938.289 Fe II -3.890 13474.411 3938.45 3938.400 Mg I -0.760 35051.263 3943.97 3944.006 Al I -0.620 0.000 3944.01 3944.101 Ni I +0.130 29320.783 3945.32 3945.210 Fe II -4.250 13673.186 3946.51 3946.487 Ni II -1.600 76402.031 3947.42 3947.480 O I -2.430 73768.202 3948.99 3949.056 La II 0.410 3250.350 ? 3949.85 3949.953 Fe I -1.160 17550.800 3950.28 3950.352 Y II -0.490 840.213

3950.389 Dy II 0.100 10953.940 3951.14 3951.150 Fe I -0.600 33412.716

3951.163 Fe I -0.380 26406.404 3952.06 3951.065 V II -0.740 11908.270 3956.71 3956.710 Fe I -0.430 21715.731

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

3961.60 3961.600 Al I -0.320 112.061 3968.50 3968.469 Ca II -0.170 0.000 3979.59 3979.505 Cr II -0.730 45730.581 3981.81 3981.771 Fe I -1.080 21999.128 3983.951 3983.838 Hg II -3.000 35514.000 hfs iso 3983.957 3983.844 Hg II -3.130 35514.000 3983.966 3983.853 Hg II -3.000 35514.000 3984.025 3983.912 Hg II -2.500 35514.000 3984.045 3983.932 Hg II -3.100 35514.000 3984.054 3983.941 Hg II -2.900 35514.000 3984.106 3983.993 Hg II -2.400 35514.000 3984.185 3984.072 Hg II -1.700 35514.000 3984.12 3984.183 Mn I -1.490 25280.982 3986.57 3986.581 Mn II -2.600 44138.961 3987.84 3987.930 Fe I -1.800 33412.716 3991.01 3990.977 Fe II -1.600 79331.503 3994.03 3994.006 Fe II -1.810 88723.398 3997.31 3997.392 Fe I -0.390 21999.129 3998.88 3998.985 Zr II -0.520 4205.500 4002.14 4002.083 Fe II -3.470 22409.852 4002.67 4002.592 Si II -0.610 83801.952 4003.08 4003.146 Mn II -9.831 109241.500 4003.59 ?

4005.17 4005.242 Fe I -0.640 12560.933 4005.44 4005.467 Tb II 0.570 1016.380 4005.70 4005.706 V II -0.460 14655.630 4005.86 4005.804 Mn II -1.350 81993.850 4009.73 4009.713 Fe I -1.200 17927.381 blend 4012.31 4012.385 Ti II -1.610 4628.580

4012.386 Ce II 0.470 4523.033 4012.42 4012.386 Ce II 0.470 4253.033 4012.50 4012.496 Cr II -0.890 45669.369

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4012.59 ?

4014.56 4014.531 Fe I -0.200 24574.652 4015.58 4015.506 Fe I -0.950 33695.394 4017.30 4017.282 V II -1.210 30613.920 4021.68 4021.728 Nd II -0.300 1470.105 4021.88 4021.866 Fe I -0.660 22249.428 4023.20 4023.220 Sm II -1.070 326.460 4023.51 4023.520 Ca I -2.270 23652.305

4023.578 La II -0.600 14375.170 4024.53 4024.547 Fe II -2.480 36252.917 4024.66 4024.725 Fe I -0.710 26140.178 4025.24 4025.223 C I -2.870 60362.630 4026.29 4026.187 He I -0.700 169086.867 4026.318 Al II -1.740 110089.834 4028.22 4028.322 Dy II 1.27 20884.419 4028.39 4028.338 Ti II -0.960 15257.553

4028.465 Si II -0.360 84004.259 4029.56 4029.622 Fe I -1.940 26339.695 4029.88 4029.684 Zr II -0.600 5752.920 4030.58 4030.488 Fe I -0.550 25893.936 4033.020 4032.940 Fe II -2.570 36254.622

4033.070 Mn I -0.620 0.000 4035.59 4035.595 Fe I -1.100 34039.315 5 % line 4035.604 V II -0.960 4035.604 4036.80 4036.806 Cr I 20520.900 4037.98 4037.972 Cr II -0.560 52321.010 4041.39 4041.360 Mn I 0.280 17052.289 4043.97 4043.897 Fe I -0.830 26140.178 broad blend 4043.977 Fe I -1.130 26140.178 4044.012 Fe I -2.410 44929.438 4045.81 4045.812 Fe I +0.280 11976.238 18 % line 4048.83 4048.831 Fe II -2.150 44917.017 asymetric

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4051.87 4051.930 Cr II -2.190 25033.700 4053.85 4053.834 Ti II -1.210 15265.119 4057.46 4057.461 Fe II -1.550 58668.776

4057.442 Dy II 0.960 23707.180 4057.505 Mg I -1.200 35031.263 4063.58 4063.594 Fe I 0.07 12560.933 14 % blend 4063.69 4063.637 Fe I -0.800 33095.940 idem 4063.70 4063.733 Mn I -1.760 34250.619 idem 4063.848 Mn I -0.650 37789.930 idem 4067..04 4067.031 Ni II -1.830 32496.075 4068.04 4067.978 Fe I -0.130 25899.986 4070.86 4070.840 Cr II -0.750 52321.189 4071.73 4071.738 Fe I -0.020 12968.554

4071.775 Ce II -0.150 2634.686 12 % line 4075.58 4075.623 Cr II -3.470 25035.399 4076.75 4076.780 Si II -1.700 79338.502 broad blend 4076.800 Fe I -1.180 26339.695 4077.73 4077.709 Sr II 0.170 0.000 4118.57 4118.545 Fe I 0.280 28819.950 broad blend 4122.72 4122.638 Fe II -3.300 20830.553 4128.02 4128.054 Si II 0.360 79338.502 4128.84 4128.735 Fe II -3.600 20830.553 4130.88 4130.872 Si II -0.780 79355.019

4130.890 Si II 0.550 79355.019 4132.14 4132.058 Fe I -0.650 12968.554 4134.71 4134.677 Fe I -0.490 22838.320 4136.97 4136.902 Mn II -1.250 49514.374

4136.998 Fe I -0.540 27543.002 4143.39 4143.415 Fe I -0.200 24574.652

4143.430 N I -2.090 83317.831 4143.73 4143.826 Fe I -1.270 23051.748

4143.868 Fe I -0.450 12560.934

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4144.02 4144.078 Fe I -2.565 58906.436 4145.78 4145.782 Cr II -1.160 42900.629 4149.23 4149.217 Zr II -0.030 6467.610 4154.67 4154.499 Fe I -0.690 22838.320 4154.805 Fe I -0.370 27166.817 4161.522 4161.535 Ti II -2.360 8744.250 4162.73 4162.665 S II 0.780 128599.162 4163.59 4163.644 Ti II -0.130 20891.790 4167.28 4167.271 Mg I -1.600 35051.263 4167.299 Fe II -0.560 90300.626 4171.02 4171.033 Mn II -2.340 49425.654 4171.86 4171.903 Cr II -2.380 25042.811 4171.904 Ti II -0.290 20951.754 4172.05 4172.122 Fe I -0.900 26224.966 4173.50 4173.450 Fe II -2.160 20830.553 4173.537 Ti II -2.000 8744.250 4174.27 4174.265 S II 0.800 140319.232 4175.76 4175.83 Fe II 90487.827 4176.60 4176.566 Fe I -0.620 27166.817 4167.599 Mn I -0.120 34138.880 4177.66 4177.530 Y II -0.160 3298.808 9 % line 4177.686 Fe II -3.450 20518.744 4178.73 4178.711 Fe I -2.930 35856.400 4178.84 4178.855 Fe II -2.440 20830.553 4179.00 4179.054 V II -2.500 13608.961 4179.42 4179.421 Cr II -1.800 30866.837 4179.393 Pr II 0.510 1649.010 4179.54 4179.421 Cr II -1.770 30864.459 4179.70 4179.807 Zr II -0.780 13428.500 4181.58 4181.513 Cr II -2.500 45730.581 4181.580 Fe II -1.860 90898.872 4181.75 4181.755 Fe I -0.180 22838.320

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4183.28 4183.200 Fe I -4.870 21308.040 broad absorbtion 4184.82 4184.867 Si II -0.390 131677.039 4186.99 4187.039 Fe I -0.550 19757.031 4187.81 4187.795 Fe I -0.550 19562.437 4188.89 4188.914 Fe II -2.820 84863.353

4188.977 Fe II -1.310 90780.619 4190.70 4190.707 Si II -0.330 108820.317 4191.50 4191.430 Fe I -0.670 19912.494 4191.77 4191.750 Cr I -2.500 20523.629 4195.19 4195.184 Dy II -0.360 9870.990 4195.41 4195.417 Cr II -2.320 42897.990 4195.60 4195.618 Fe I -1.800 24335.763 4198.33 4198.304 Fe I -0.720 19350.891 4199.15 4199.095 Fe I 0.250 24574.655 4200.77 4200.658 Si II -0.890 101023.046

4200.778 Fe I -4.030 12968.554 4202.02 4202.029 Fe I -0.710 11976.238 4204.02 4203.965 Fe I -1.010 26406.464 4205.48 4205.48 Fe I -5.380 29313.051

4205.381 Mn II -3.380 14593.879 4209.00 4208.977 Zr II -0.460 5752.920 4210.35 4210.343 Fe I -0.870 20019.633 4211.90 4211.907 Zr II -1.080 4248.300 4213.54 4213.518 Fe II -2.210 62693.478 4215.53 4215.519 Sr II -0.170 0.000 15 % line 4217.43 4217.419 Ho III -1.080 8645.000 4219.39 4219.360 Fe I 0.120 19.952 4222.09 4222.104 N I -1.590 83317.031 4222.44 4222.381 Zr II -0.900 9742.800 4224.96 4224.860 Cr II -1.250 42989.353 very broad line 4226.73 4226.728 Ca I 0.240 0.000 resonance 4227.43 4227.427 Fe I 0.230 26874.546

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4233.15 4233.172 Fe II -2.00 20830.582 21 % line 4233.243 Cr II -2.120 31168.581 4235.95 4235.936 Fe I -0.340 19562.437 4238.82 4238.731 Mn II -3.680 14781.170 4238.810 Fe I -0.280 27394.689 4238.819 Fe II -2.720 54902.315 4242.39 4242.333 Mn II -1.260 49820.159 4242.364 Cr II -0.590 31219.350 4242.448 Mg II -1.070 9330.590 4244.90 4244.963 Nd II -1.030 1650.205 4246.85 4246.85 Sc II 0.320 2540.980 4247.49 4247.425 Fe I -0.230 27166.817 4250.14 4250.119 Fe I -0.410 19912.491 4250.30 4250.359 Fe II -6.150 79885.523 wrong gf ? 4250.74 4250.787 Fe I -0.710 12560.933 4252.71 4252.632 Cr II -2.020 31117.390 4252.726 Fe II -2.290 74606.841 4252.755 Fe II -2.170 82853.660 4254.43 4254.336 Cr I -0.110 0.000 resonance 4254.522 Cr II -0.970 47354.440 4528.21 4528.15 Fe II -3.400 21812.055 4259.06 Mn II 15 hfs 4259.27 Mn II 4260.42 4260.467 Mn II -4.250 14901.180 4260.474 Fe I -0.020 19350.891 4261.91 4261.913 Cr II -1.530 31168.581 4261.847 Cr II -3.000 25033.700 4263.89 4263.869 Fe II -1.710 62049.023 4263.849 V II -2.680 13594.730 4267.14 4267.001 C II 0.563 145549.27 4267.261 C II 0.716 145550.70 4267.261 C II -0.584 145550.70

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4269.28 4269.277 Cr II -2.170 31082.940 4271.134 4271.153 Fe I -0.350 19757.031 13 % blend 4271.80 4271.750 Fe I -0.160 11976.238 4273.24 4273.326 Fe II -3.260 21812.055 4273.38 4273.326 Fe II -3.260 21812.055 4274.76 4274.797 Cr I -0.230 0.000 resonance 4275.61 4275.606 Cr II -1.710 31117.390 4278.20 4278.159 Fe II -3.820 21711.917 4282.45 4282.403 Fe I -0.810 17550.180

4282.490 Mn II -1.680 44521.521 4284.35 4284.429 Mn II -2.270 43311.301 4287.91 4287.940 Fe I -2.110 27666.345

4287.872 Ti II -2.020 8710.440 4289.50 4289.58 Mn II -2.266 43339.452 4290.66 4290.624 Fe I -4.660 29313.005 wrong gf ? 4294.06 4294.099 Ti II -1.110 8794.250

4294.125 Fe I -1.110 11976.238 4296.59 4296.572 Fe II -3.010 21812.055 4299.18 4299.234 Fe I -0.430 19562.437 4301.93 4301.914 Ti II -1.160 9363.620 4302.08 4302.186 Fe I -1.740 24574.652 4303.17 4303.176 Fe II -2.490 21812.055 16 % line 4305.38 4305.443 Sr II -0.140 24516.650

4305.450 Fe I -1.300 24335.763 4307.87 4307.863 Ti II -1.290 9393.710

4307.902 Fe I -0.070 12560.933 4309.50 4309.631 Y II -0.750 1449.808 4312.87 4312.864 Ti II -1.160 5518.060 4313.89 4313.957 Fe II -6.588 104315.373 wrong gf 4314.18 Sc II 5 hfs 4314.97 4314.975 Ti II -1.130 9363.620

4314.979 Fe II -3.100 38164.195

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4316.75 4316.799 Ti II -1.420 16615.060 4320.75 4320.725 Sc II -0.260 4883.370 4325.20 4325.176 Fe I -1.580 24338.766 4325.73 4325.762 Fe I -0.010 12968.554

4325.758 Nd II 0.010 3801.990 4351.81 4351.769 Fe II -2.100 21812.055

4351.811 Cr I -0.440 8307.577 4357.56 4357.584 Fe II -2.110 49100.978 4359.75 4359.720 Zr II -0.460 9968.650

4359.786 Fe II -2.590 50212.823 4362.11 4362.099 Ni II -2.720 32499.529 broad blend 4368.05 4368.03 Sm II -1.110 3052.690 4369.45 4369.411 Fe II -3.670 22469.852 4371.29 4371.27 Cr I -1.090 8095.1842 4374.35 4374.426 Cr I -4.737 27703.777 wrong gf 4374.74 4374.765 Dy II -1.100 4341.100

4374.815 Ti II -1.290 16625.110 4375.03 4374.965 Y II 0.160 3296.184 4383.62 4383.545 Fe I 0.200 11976.238 4384.52 4384.637 Mg II -0.790 80619.500 4385.38 4385.387 Fe II -2.570 22409.852 4386.86 4386.844 Ti II -1.260 20951.600 4388.10 4388.078 Mn I -1.250 38120.18 4390.55 4390.514 Mg II -1.490 80550.022

4390.572 Mg II -0.530 80550.022 4394.07 4394.051 Ti II -1.590 9850.900 4395.08 4395.033 Ti II -0.660 8744.250 15 % 4395.86 4395.817 Fe II -1.200 90487.811

4395.850 Ti II -2.170 10024.730 4399.73 4399.772 Ti II -1.270 9975.920 4400.50 4400.379 Sc II -0.510 4883.570 4401.61 4401.68 Cr II -1.430 7103.000 ?

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4402.99 4403.033 Fe II -4.187 87759.062 wrong gf 4404.75 4404.750 Fe I -0.140 12560.933 10 % line 4404.750 Zr II -1.100 14739.350 4409.50 4409.516 Ti II -2.570 9930.690 4411.08 4411.074 Ti II -1.050 24961.031 4413.67 4413.601 Fe II -3.870 21581.638 4415.17 4415.122 Fe I -0.620 12968.354 4416.78 4416.830 Fe II -2.600 22409.852 4416.89 4416.830 Fe II -2.600 22409.852 4417.69 4417.719 Ti II -1.435 9395.710 4418.37 4418.330 Ti II -2.460 9975.920 4421.92 4421.938 Ti II -1.779 16625.110 4425.46 4425.53 Fe I -6.806 5999.394 wrong gf 4427.28 4427.298 Fe I -1.250 42225.410 4427.310 Fe I -3.040 415.933 4427.95 4427.994 Mg II -1.210 80619.500 4430.56 4430.614 Fe I -1.660 17927.381 4434.03 4433.988 Mg II -0.910 80550.022 4434.067 Mn II -1.510 53017.157 4434.98 4434.957 Ca I -0.030 15210.063 4443.00 4443.008 Zr II -0.420 11984.460 4443.84 4443.794 Ti II -0.700 8710.440 4444.50 4444.539 Fe II -2.530 50157.455 4444.558 Ti II -2.030 8997.710 4447.50 4447.504 Fe II -0.920 90397.870 4449.60 4449.646 Fe II -1.590 63948.792 4450.49 4450.482 Ti II -1.450 8744.250 broad 4451.52 4451.551 Fe II -1.840 49506.935 4451.62 4451.606 Mn I 0.280 2328.670 4454.60 4454.629 Sm II -0.590 4386.030 4455.03 4455.031 Mn I -0.390 24779.319 4455.25 4455.266 Fe II -2.140 50212.823

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4455.68 4455.621 Fe I -1.160 36766.964 4456.48 4456.465 Fe II -1.120 91048.254 4457.26 ?

4459.09 4459.117 Fe I -1.280 17550.180

4459.027 Ni I -0.150 26665.902 4461.55 4461.653 Fe I -3.210 704.007 4464.53 4464.450 Ti II -2.080 9363.620 4466.60 4466.551 Fe I -0.590 22838.320 4468.51 4468.507 Ti II -0.600 9118.260 15 % blend 4469.32 4469.376 Fe I -0.260 29469.023 4471.54 4471.473 He I -0.280 169086.867

4471.488 He I -0.550 169086.943 4472.91 4472.929 Fe II -3.450 22939.350 4476.12 4476.068 Fe I -2.700 26623.794 4478.62 4478.637 Mn II -0.950 53597.132 4481.24 4481.126 Mg II 0.749 71490.190

4481.150 Mg II -0.553 71490.190 4481.325 Mg II 0.594 71491.060 4484.25 4484.220 Fe I -0.720 29056.322 4484.91 4489.921 Fe II -7.500 16369.360 wrong log(gf) ? 4488.33 4488.33 Ti II -0.820 25192.791 4489.18 4489.179 Ca II -0.618 68056.699 10 % 4489.179 Ca II -0.730 68056.699 4389.183 Fe II -1.970 22810.356 4491.46 4491.405 Fe I -2.700 23031.299 4493.58 4493.512 Ti II -2.780 8710.440

4493.529 Fe II -1.430 63876.319 4494.65 4494.563 Fe I -1.140 17726.988

4494.523 Ho III -1.360 0.000 4496.91 4496.980 Zr II -0.890 57329.920

4496.986 Mn II -0.860 85895.298 4501.28 4501.273 Ti II -0.750 8937.710 14 %

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4508.24 4508.288 Fe II -2.210 23031.299 4515.34 4515.339 Fe II -2.480 22939.357 4518.40 4518.327 Ti II -2.550 8710.440 4520.24 4520.224 Fe II -2.600 22637.205 blend 4520.244 Fe I -2.500 24772.016 4522.65 4522.634 Fe II -2.030 22939.357 15 % line 4522.602 Eu II -0.680 1669.210 4522.636 Eu II -0.680 1669.210 4522.658 Eu II -0.680 1669.210 4525.05 4525.034 Fe II -3.060 50075.928

4525.137 Fe I -0.340 29056.322 4526.492 452 6.489 Fe II -1.430 90901.125 4528.49 4528.473 Ce II 0.070 6967.547

4528.503 V II -1.310 33500.854 4528.614 Fe I -0.822 17550.181 4529.48 4529.569 Fe II -3.190 44929.519 4534.04 4533.969 Ti II -0.770 9975.920 20 % line 4539.60 4539.608 Cr II -2.530 32603.400 4541.55 4541.524 Fe II -3.050 23031.299 9 % line 4545.04 4545.133 Ti II -1.870 9118.260

4545.148 Fe II -2.460 62689.878 4549.53 4549.474 Fe II -1.750 22810.356 33 % line 4549.617 Ti II -0.450 12774.689 4554.01 4554.033 Ba II 0.140 0.000 10 % line, 15 hfs iso 4554.99 4555.027 Fe I -1.090 31307.244 4555.94 4555.846 Fe II -4.120 32277.322

4555.887 Ca I -0.540 15315.940 4558.66 4558.650 Cr II -0.660 32854.311 4563.69 4563.761 Ti II -0.960 9850.900 4565.76 4565.740 Cr II -2.110 32603.400 4571.98 4571.968 Ti II -0.330 12676.970 15 % line 4576.36 4576.340 Fe II -3.040 22439.357 7 % line

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4579.80 4579.86 Co I -2.657 54561.681 blend 4582.88 4582.835 Fe II -3.100 22939.357 4583.85 4583.837 Fe II -2.020 22637.205 20 % line 4588.20 4588.199 Cr II -0.630 32836.680 4590.03 4589.958 Ti II -1.790 9975.920

4589.967 O I -2.290 86631.453 4592.10 4592.049 Cr II -1.220 32854.949 4593.87 4593.807 Cr II -4.920 23317.632 4596.05 4596.015 Fe II -1.840 30212.823 4598.56 4598.494 Fe II -1.500 62945.040 4600.26 4600.627 Ti II -3.620 10024.730 wrong gf ? 4604.99 4605.06 Cr I -3.361 42261.229 4616.64 4616.629 Cr II -1.290 32844.760 4618.84 4618.803 Cr II -1.110 32854.949 4620.52 4620.521 Fe II -3.280 22810.356 4621.78 4621.722 Si II -0.380 101024.439 4625.90 4625.893 Fe II -2.200 48039.077 4629.29 4629.279 Ti II -2.240 9518.060

4629.339 Fe II -2.370 22637.205 13 % 4634.98 4634.070 Cr II -1.240 32844.760 4635.22 4635.316 Fe II -1.650 48039.087 4638.18 4638.050 Fe II -1.520 62171.614 4648.90 4648.944 Fe II -4.390 20830.582 4654.48 4654.498 Fe I -2.780 12560.953 4657.10 4656.981 Fe II -3.630 23317.632 4657.206 Ti II -2.150 10024.730 4663.06 4663.046 Al II -0.280 85481.548 4663.77 4663.708 Fe II -4.270 23317.632 4665.72 4665.79 Fe II -4.860 21812.045 wrong gf ? 4666.72 4666.758 Fe II -3.330 22810.356 4670.17 4670.182 Fe II -4.100 20830.582 4679.07 4679.159 Ni II -1.750 56371.411

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4702.95 4702.991 Mg I -0.670 35051.263 4702.991 Zr II -0.800 20080.301 4707.37 4707.382 Ti II -4.170 42208.591 4708.66 4708.665 Ti II -2.210 9375.920

4708.750 Fe II -2.350 78577.282 4714.41 4714.410 Mn II -3.550 14593.819 4736.82 4736.773 Fe I -0.740 25899.986 4731.45 4731.453 Fe II -3.360 23317.632 4755.78 4755.727 Mn II -1.240 43528.639 4762.58 4762.538 C I -2.440 60352.630 4764.71 4764.738 Mn II -1.350 43357.156 4770.00 4770.027 C I -2.720 60352.630 4771.73 4771.742 C I -2.120 60393.138 4775.89 4775.897 C I -2.160 60393.138 4780.06 4779.985 Ti II -1.370 16518.860 4786.57 4786.580 Y II -1.290 8328.041 4805.07 4805.085 Ti II -1.100 16625.110 4812.46 4812.468 Fe I -5.400 22249.428 wrong gf ? 4824.15 4824.126 Cr II -1.220 31219.350 10 % line 4836.14 4836.229 Cr II -2.250 31117.390 4848.25 4848.235 Cr II -1.140 31168.581 4876.47 4876.399 Cr II -1.460 31082.940 4876.473 Cr II -1.460 31168.581 4883.67 4883.684 Y II 0.070 8743.816 4890.87 4890.755 Fe I -0.430 23192.497 4891.53 4891.492 Fe I -0.140 22996.673 4891.485 Cr II -3.040 31350.901 4900.17 4900.120 Y II -0.090 8328.041 4911.23 4911.193 Ti II -0.340 25192.791 4919.01 4918.994 Fe I -0.370 23110.937 4918.954 Fe I -0.340 33507.120 4920.57 4920.502 Fe I 0.060 22845.868

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

4922.14 4922.192 Fe II -0.800 83558.539 4923.96 4924.030 Fe II -1.321 23317.632 20 % line 4932.10 4932.049 C I -1.880 61981.822

4932.080 Fe II -1.730 83196.488 4934.11 4934.076 Ba II -0.150 0.000 resonance 4951.62 4951.584 Fe II 0.180 83136.488 4957.65 4957.596 Fe I 0.130 22650.014 very broad blend 4957.692 Fe I -0.330 33801.571 4967.97 4967.897 Fe I -0.530 33811.571 4968.77 4968.698 Fe I -1.780 29356.743 4982.59 4982.499 Fe I 0.160 33095.940 4984.30 4984.276 Mn II -3.270 94886.504 wrong gf ? 4990.38 4990.441 Cr II -2.380 47354.440 wrong gf ? 4990.73 4990.768 Fe II -3.850 64831.941 wrong gf ? 4991.26 4991.268 Fe I -0.670 33801.571

4991.326 C I -2.470 69744.032 4992.11 4992.093 Mn II -3.670 86936.810 wrong gf ? 4993.53 4993.680 Fe I -1.450 33946.933 5001.88 5001.863 Fe I 0.010 31307.244

5001.959 Fe II 0.900 82853.660 5004.16 5004.195 Fe II 0.500 82853.660 5006.86 5006.841 Fe II -0.430 83713.596 5007.55 5007.447 Fe II -0.360 83726.362 5010.04 5010.06 Fe II -0.850 83726.362 5013.93 5014.042 S II 0.030 113461.337 5015.52 5015.520 Fe II -2.520 73395.932 5018.45 5018.440 Fe II -1.220 23337.033 20 % 5019.95 5019.971 Ca II -0.260 60611.279

5020.015 Fe II -0.720 22978.679 5022.54 5022.583 Fe II -4.040 44929.549 5030.81 5030.89 Fe II -1.772 104588.729 5032.72 5032.712 Fe II 0.110 83812.217

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

5040.94 5040.907 Fe I -0.500 34547.209

5041.024 Si II 0.290 81191.341 5047.75 5047.641 Fe II -0.070 83136.488

5047.783 O I -2.520 88631.144 5047.823 O I -3.220 88631.302 5048.78 5048.843 Ni I -0.380 31031.041 5052.15 5052.167 C I -1.650 61981.822 5056.11 5056.194 Ni II 0.500 99154.808 5056.81 5056.718 Fe II 0.220 83136.488 broad blend 5065.10 5065.018 Fe I -0.450 34328.750

5065.097 Fe II -0.450 84131.564 5065.193 Fe I -1.510 29371.811 5070.70 5070.78 Co I -3.341 55165.690 5080.60 5080.528 Ni I 0.130 29481.020 5082.32 5082.230 Fe II -0.100 83990.065 5087.44 5087.416 Y II -0.170 8743.316

5087.350 Fe II -1.830 83459.671 5093.47 5093.465 Fe II -2.140 54870.528

5093.576 Fe II 0.110 83713.536 5097.16 5097.270 Fe II 0.310 83713.536 5098.81 5098.70 Fe I -2.030 17550.181 5100.49 5100.607 Fe II 0.170 83726.362 5100.80 5100.852 Fe II -1.780 47674.718

5100.727 Fe II 0.700 83726.362 5129.18 5129.152 Ti II -1.390 15257.430 5133.81 5133.688 Fe I 0.140 33695.394 5137.16 5137.088 Cr II -1.530 55023.098 5139.43 5139.462 Fe I -0.570 23711.453 5142.48 5142.486 Cr II -2.190 50667.272

5142.541 Fe I -0.140 34328.750 5144.30 5144.355 Fe II 0.280 84424.372 5146.08 5146.127 Fe II -3.910 22810.356

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

5149.42 5149.465 Fe II 0.400 84266.557 5154.10 5154.070 Ti II -1.920 12628.731 5157.36 5157.282 Fe II -0.310 84236.910 5160.84 5160.839 Fe II -2.640 44915.046 5162.84 5162.92 N I -1.405 94881.820 5167.37 5167.321 Mg I -1.030 21850.405 12 % 5167.488 Fe I -1.260 11976.238 5169.07 5169.033 Fe II -0.870 23317.632 20 % 5171.54 5171.596 Fe I -1.790 11976.238 5171.640 Fe II -4.370 22637.205 5172.73 5172.684 Mg I -0.400 21870.163 15 % 5177.21 5177.333 Fe I -2.420 29798.933 5180.14 5180.170 Fe I -1.230 40257.311 5183.52 5183.600 Mg I -0.180 21911.173 18 % 5185.80 5185.902 Ti II -1.350 15265.701 3 % 5188.77 5188.69 Ti II -1.210 12758.260 7 % 5191.52 5191.454 Fe I -0.550 24506.914 5192.50 5192.442 Fe II -2.020 5192.442 5195.00 5195.124 Pr II -0.130 8950.490 broad 5196.30 5196.44 Fe II -1.020 83713.536 5197.59 5197.577 Fe II -2.100 26055.422 10 % 5197.480 Fe II -2.720 48039.087 5197.577 Fe I -2.320 39969.851 5199.15 5199.122 Fe II 0.100 3713.536 5205.74 5205.724 Y II -0.340 8328.041 5208.88 5208.425 Cr I 0.160 7593.150 5210.64 5210.626 Fe I -3.580 39625.801 wrong gf ? 5211.39 5211.47 Mn I -7.870 47212.078 wrong gf 5213.57 5213.540 Fe II -0.820 84870.863 5215.48 5215.349 Fe II -0.010 83713.536 5216.83 5216.814 Fe II -0.230 83726.362 5226.84 5226.862 Fe I -0.550 24506.914 broad

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

5226.897 Fe I -1.250 34636.789 5226.899 Cr I -2.010 27222.944 5227.41 5227.481 Fe II 0.800 84296.829 7 % broad 5227.323 Fe II -0.030 84344.832 5232.85 5232.787 Fe II -0.060 83726.362 5 % 5232.940 Fe I -0.190 2378.453 5234.59 5234.625 Fe II -2.250 25981.630 10 % 5237.29 5237.329 Cr II -1.150 32854.311 5 % 5247.95 5247.952 Fe II 0.630 84938.177 5249.39 5249.344 Fe II -0.600 83930.015 5249.437 Cr II -2.430 30307.439 5251.26 5251.233 Fe II 0.510 84844.832 5251.211 Fe II -0.850 84236.910 5253.55 5253.479 P II 0.290 85893.219 5253.514 Fe II -1.100 84296.829 5253.641 Fe II -0.090 84296.829 5254.12 5234.140 Cr I -1.950 35397.270 5257.09 5257.122 Fe II 0.030 84685.198 5260.29 5260.259 Fe II -1.070 84035.139 5264.10 5264.177 Fe II 0.360 84710.686 5264.59 5264.697 Fe II -2.810 65696.036 5266.55 5266.555 Fe I -0.490 24180.861 5266.87 5266.957 Co I -7.244 57813.258 wrong gf 5269.70 5269.537 Fe I -1.320 6928.268 5270.30 5270.356 Fe I -1.510 12968.554 5272.32 5272.337 Fe II -2.030 48039.087 5275.01 5274.964 Cr II -1.29 32836.680 5276.11 5276.002 Fe II -1.940 25805.329 12 % 5279.99 5279.876 Cr II -2.100 32851.311 5280.054 Cr II -2.010 32854.949 5280.13 5280.054 Cr II -2.010 32834.949 5281.62 5281.63 Fe I 4059.432

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

5281.93 5282.01 Fe II -2.795 108929.031 5283.33 5283.44 Ti II 12156.802 5283.94 5284.109 Fe II -3.190 23317.632 5 % 5291.66 5291.666 Fe II 0.58 84527.779 5294.00 5294.086 Fe I -0.660 40842.150 5294.099 Nd III -0.650 0.000 resonance 5299.20 5299.30 Mn II -0.420 79558.538 5302.35 5302.300 Fe I -0.880 26479.378 5302.342 Mn II -0.820 79569.268 5302.402 Mn II 0.230 79569.268 5302.431 Mn II 1.000 79569.268 5305.99 5306.180 Fe II 0.220 84870.863 5305.929 Cr II 0.110 86732.041 5307.22 5307.224 Ca II -0.850 60611.179 5308.36 5308.408 Cr II -1.810 32836.680 5310.65 5310.635 Fe II -0.860 84527.779 5310.687 Cr II -2.880 32844.700 5313.57 5313.563 Cr II -1.650 32854.949 5316.63 5316.615 Fe II -1.850 25428.783 20 % line 5324.14 5324.179 Fe I -0.240 25899.986 5325.50 5325.503 Fe II -2.800 25981.670 5328.11 5328.039 Fe I -1.470 7376.64 0 5328.90 5328.934 Fe II -0.790 84938.177 5329.68 5329.673 O I -2.200 86627.777 O I -1.610 86627.777 O I -1.410 86627.777 5330.73 5330.741 O I -1.120 86631.453 5334.85 5334.869 Cr II -1.560 32844.760 5336.80 5336.88 V II -4.058 216464.20 wrong gf 5337.80 5337.732 Fe II - 3.890 26055.422 5337.772 Cr II -2.030 32854.949 5339.57 5339.585 Fe II 0.540 84296.829

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

5362.92 5362.869 Fe II -2.740 25805.329 10 % line 5362.957 Fe II -0.080 84685.798 5364.78 5364.871 Fe I 0.220 53856.400 5367.44 5367.466 Fe I 0.350 35611.622 5370.11 5369.961 Fe I 0.350 35257.323

5370.164 Cr II 0.320 86782.011 5371.42 5371.489 Fe I -1.650 7728.059

5371.437 Fe I -1.240 35767.561 5380.68 5380.786 Cr II -0.700 86980.102 5381.08 5381.015 Ti II -2.080 12628.731 5383.39 5383.369 Fe I 0.500 34782.420 5387.02 5387.063 Fe II 0.520 84863.353 5395.82 5395.857 Fe II 0.360 85495.303

5395.751 Cr II 0.910 86980.102 5401.90 5402.059 Fe II 0.500 85184.734 5404.11 5404.117 Fe I 0.540 34782.420

5404.151 Fe I 0.520 35767.561 5405.67 5405.663 Fe II -0.440 48708.863

5405.775 Fe I -1.840 7985.784 5407.40 5407.604 Cr II -2.090 30864.459 5408.30 5408.373 Ti I -3.007 43592.120 wrong gf 5411.05 5410.910 Fe I 0.280 36079.371 5414.56 5414.850 Fe II -0.310 84863.359 broad blend 5414.862 Cr II -1.780 55023.098 5414.925 Fe II -2.290 83130.901 5424.17 5424.068 Fe I 0.320 34843.954 5425.07 5425.257 Fe II -3.360 25805.329 5427.90 5428.826 Fe II -1.660 54232.193 5429.87 5429.988 Fe II 0.460 85462.859 5433.00 5432.967 Fe II -3.630 26352.767 5433.67 5433.643 Fe I -0.840 40871.951 5434.36 5434.315 Mn II -2.040 84307.200

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

5435.14 5435.178 O I -1.880 86625.757 5436.68 5436.618 Fe II -0.950 85048.600 5455.54 5455.454 Fe I 0.300 34843.954 5455.462 Dy II -0.541 9492.000 5465.99 5465.931 Fe II 0.520 85679.698 5466.90 5466.908 Fe II -1.880 54902.319 5466.894 Si II -0.040 101024.349 5481.18 5481.24 Fe I -1.400 33095.941 5481.27 Fe II -1.210 85462.937 5482.21 5482.308 Fe II 0.430 85184.734 5487.53 5487.619 Fe II 0.360 85462.859 5492.05 5492.033 Fe II -0.900 85495.303 5492.079 Fe II -0.180 85679.698 5493.86 5493.833 Fe II 0.210 81685.198 5493.876 Fe I -0.620 45293.630 5502.08 5502.067 Cr II -1.990 33618.940 5503.28 5503.211 Fe II -0.090 8468.514

5503.212 Cr II -2.310 33417.990 5503.358 Fe II -0.591 85495.303 5506.25 5506.195 Fe II 0.950 84863.353 5508.72 5508.610 Cr II -2.110 33521.110 broad 5510.66 5510.639 Fe II -1.000 85184.734 5510.702 Cr II -2.450 30864.459 5510.779 Fe II 0.000 85184.734 5525.34 5525.43 Fe II -4.255 105630.764 wrong gf 5526.86 5526.770 Sc II 0.130 14261.320 5528.50 5528.405 Mg I -0.620 35051.263 5529.92 5529.932 Fe II -1.870 54273.640 5534.83 5534.847 Fe II -2.940 26170.181 5 % 5534.890 Fe II -0.690 85048.620 5544.70 5544.763 Fe II 0.128 84863.353 5549.00 5549.001 Fe II -0.230 84870.863

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

5567.95 5567.842 Fe II -1.890 54283.218 5569.58 5569.617 Cr II 0.080 87948.549 5569.618 Fe I -0.540 27559.582 5572.84 5572.842 Fe II -0.310 27394.689 5576.00 5575.967 Si II -1.670 103885.252 5575.980 cr II -0.100 87666.259 5576.089 Fe I -1.000 27666.345 5578.00 5577.915 Fe II -0.140 85462.859 5577.997 Fe II -0.610 85495.303 5586.79 5586.842 Cr II 0.910 88001.361 5586.756 Fe I -0.210 27166.817 5588.61 5588.619 Cr II -5.550 31117.390 wrong gf 5594.44 5594.462 Ca I -0.050 20349.261 5594.563 Fe II -1.130 85495.303 5598.30 5598.287 Fe I -0.370 37521.157 5603.12 5603.065 Mn I -2.400 35041.370 ? 5615.69 5615.644 Fe I -0.140 26874.547 5643.92 5643.880 Fe II -1.460 61726.078 asymetric 5662.74 5662.93 Y II 0.340 15682.898 5748.28 5748.286 Fe II -0.680 87471.765 5813.66 5813.677 Fe II -2.750 44929.549 5851.34 5851.442 V II -0.960 73530.712 6024.27 6024.178 P II 0.140 86743.961 6103.49 6103.496 Fe II -2.170 50142.788 6141.64 6141.713 Ba II -0.030 5674.824 broad 6141.731 Fe I -1.610 29056.322 6147.62 6147.741 Fe II -2.720 31364.440 6149.26 6149.258 Fe II -2.720 31968.450 6155.87 6155.961 O I -1.400 86625.757 6155.971 O I -1.050 86625.757 6155.989 O I -1.160 86625.757 6156.62 6156.737 O I -1.520 86627.777

Table 1 (continued)

λ_{obs} (Å) λ_{lab} (Å) Identification log gf E_{low} Comments

6156.755 O I -0.930 86627.777 6156.778 O I -0.730 86627.777 6158.17 6158.149 O I -1.890 86631.453 6158.172 O I -1.030 86631.453 6158.187 O I -0.440 86631.453 6175.26 6175.146 Fe II -1.980 50187.813 6233.61 6233.534 Fe II -2.340 44232.513 6238.37 6238.392 Fe II -2.630 31364.440 5 % 6239.66 6239.614 Si II 0.190 103556.025 6239.665 Si II 0.080 103556.156 6247.61 6247.557 Fe II -2.330 31307.949 6347.12 6347.109 Si II 0.300 65500.472 6371.48 6371.371 Si II 0.000 65500.472 6383.61 6383.722 Fe II -2.270 44784.760 6390.04 ? 6416.90 6416.919 Fe II -2.740 31387.949 blend 6419.85 6419.949 Fe I -0.240 38175.351 asymetric 6432.48 6432.680 Fe II -3.710 23317.632 6453.56 6453.602 O I -1.360 86625.757 6456.47 6456.383 Fe II -2.070 31483.167 10 %

Table 2. Elemental Abundances from unblended lines for HR 8844. References are defined in Tab. 5.

Element λ (Å) log gf Ref. log(X/H)_{HR8844} log(X)_⊙ log(X)_⊙ − 12

He I 4471.470 -2.211 NIST/ASD -1.37 10.93 -1.07 He I 4471.474 -0.287 NIST/ASD -1.37 He I 4471.474 -1.035 NIST/ASD -1.37 He I 4471.485 -1.035 NIST/ASD -1.37 He I 4471.489 -0.558 NIST/ASD -1.37 He I 4471.683 -0.910 NIST/ASD -1.37 He I 5875.598 -1.516 NIST/ASD -1.22 He I 5875.613 -0.339 NIST/ASD -1.22 He I 5875.615 0.409 NIST/ASD -1.22 He I 5875.625 -0.339 NIST/ASD -1.22 He I 5875.640 0.138 NIST/ASD -1.22 He I 5875.966 -0.214 NIST/ASD -1.22 log(He/H) = −1.30 ± 0.45 dex [ He H ] = −0.23 ± 0.45 dex C II 4267.261 0.716 NIST/ASD -3.88 8.52 -3.48 C II 4267.261 -0.584 NIST/ASD -3.88 log(C/H) = −3.88 ± 0.34 dex [ C H ] = −0.40 ± 0.34 dex O I 5330.726 -2.416 NIST/ASD -3.27 8.83 -3.17 O I 5330.741 -0.983 NIST/ASD -3.27 O I 6155.961 -1.363 NIST/ASD -3.26 O I 6155.971 -1.011 NIST/ASD -3.26 O I 6155.989 -1.120 NIST/ASD -3.26 O I 6156.737 -1.487 NIST/ASD -3.26 O I 6155.755 -0.898 NIST/ASD -3.26 O I 6156.778 -0.694 NIST/ASD -3.26 O I 6158.149 -1.841 NIST/ASD -3.26 O I 6158.172 -0.995 NIST/ASD -3.26 O I 6158.187 -0.409 NIST/ASD -3.26 log(O/H) = −3.27 ± 0.19 dex

Table 2 continued on next page

Table 2 (continued)

Element λ (Å) log gf Ref. log(X/H)_{HR8844} log(X)_⊙ log(X)_⊙ − 12

[ O H ] = −0.09 ± 0.19 dex Mg II 4390.572 -0.523 NIST/ASD -4.72 7.58 -4.42 Mg II 4427.994 -1.208 NIST/ASD -4.82 log(Mg/H) = −4.77 ± 0.29 dex [ Mg H ] = −0.35 ± 0.29 dex Al II 4663.056 -0.244 NIST/ASD -5.53 6.47 -5.53 Al I 3944.006 -0.635 NIST/ASD -5.75 log(Al/H) = −5.64 ± 0.20 dex [ Al H ] = −0.097 ± 0.20 dex Si II 4128.054 0.359 NIST/ASD -4.60 7.55 -4.45 Si II 4130.894 0.552 NIST/ASD -4.60 Si II 4190.72 -0.351 Sh61 -4.60 Si II 5041.024 0.029 NIST/ASD -4.44 Si II 5055.984 0.523 NIST/ASD -4.52 Si II 5056.317 -0.492 NIST/ASD -4.52 Si II 6371.37 -0.082 NIST/ASD -4.27 log(Si/H) = −4.51 ± 0.09 dex [ Si H ] = −0.06 ± 0.09 dex S II 4153.06 0.395 NIST/ASD -4.67 7.33 -4.67 S II 4162.31 0.161 NIST/ASD -4.67 S II 4162.67 0.830 NIST/ASD -4.67 log(S/H) = −4.67 ± 0.16 dex [ S H ] = 0.00 ± 0.16 dex Ca II 3933.663 0.135 NIST/ASD -5.83 6.36 -5.64 log(Ca/H) = −5.83 ± 0.17 dex [ Ca H ] = −0.19 ± 0.17 dex Sc II 4246.822 0.242 NIST/ASD -9.05 3.17 -8.83 Sc II 5031.021 -0.400 NIST/ASD -8.98 Sc II 5526.813 -0.77 NIST/ASD -8.93 log(Sc/H) = −8.99 ± 0.28 dex

Table 2 continued on next page

Table 2 (continued)

Element λ (Å) log gf Ref. log(X/H)_{HR8844} log(X)_⊙ log(X)_⊙ − 12

[ Sc H ] = −0.16 ± 0.28 dex Ti II 4163.644 -0.128 NIST/ASD -6.78 5.02 -6.98 Ti II 4287.873 -2.020 NIST/ASD -6.98 Ti II 4290.210 -0.848 NIST/ASD -6.98 Ti II 4300.042 -0.442 NIST/ASD -6.68 Ti II 4411.072 -0.6767 NIST/ASD -6.78 Ti II 4468.492 -0.620 NIST/ASD -6.78 Ti II 4563.758 -0.96 NIST/ASD -6.78 Ti II 5129.156 -1.239 NIST/ASD -6.98 Ti II 5188.687 -1.220 NIST/ASD -6.87 Ti II 5336.780 -1.700 NIST/ASD -6.98 log(T i/H) = −6.83 ± 0.06 dex [ T i H ] = 0.15 ± 0.06 dex V II 4005.71 -0.450 NIST/ASD -7.77 4.00 -8.00 V II 4023.39 -0.610 K10/BGF/WLDS -7.66 V II 4036.78 -1.570 NIST/ASD -7.70 log(V/H) = −7.71 ± 0.23 dex [ V H ] = 0.29 ± 0.23 dex Cr II 4558.644 -0.660 NIST/ASD -6.12 5.67 -6.33 Cr II 4558.787 -2.460 SN14 -6.12 Cr II 5237.322 -1.160 NIST/ASD -6.33 Cr II 5308.421 -1.810 NIST/ASD -6.18 Cr II 5313.581 -1.650 NIST/ASD -6.18 Cr II 5502.086 -1.990 NIST/ASD -6.12 log(Cr/H) = −6.18 ± 0.17 dex [ Cr H ] = 0.16 ± 0.17 dex Mn II 4206.368 -1.54 NIST/ASD -6.32 5.39 -6.61 log(Mn/H) = −6.32 ± 0.08 dex [ Mn H ] = 0.30 ± 0.08 dex Fe II 4258.148 -3.500 NIST/ASD -4.65 7.50 -4.50

Table 2 continued on next page

Table 2 (continued)

Element λ (Å) log gf Ref. log(X/H)_{HR8844} log(X)_⊙ log(X)_⊙ − 12

Fe II 4273.326 -3.350 NIST/ASD -4.62 Fe II 4296.566 -2.900 NIST/ASD -4.50 Fe II 4491.397 -2.640 NIST/ASD -4.50 Fe II 4508.280 -2.300 NIST/ASD -4.50 Fe II 4515.333 -2.360 NIST/ASD -4.50 Fe II 4520.218 -2.600 NIST/ASD -4.46 Fe II 4923.921 -1.210 NIST/ASD -4.35 Fe II 5275.997 -1.900 NIST/ASD -4.50 Fe II 5316.609 -1.780 NIST/ASD -4.42 Fe II 5506.199 0.860 NIST/ASD -4.50 log(F e/H) = −4.50 ± 0.16 dex [ F e H ] = 0.00 ± 0.16 dex Ni II 4067.04 -1.834 K03 -6.05 6.25 -5.75 log(Ni/H) = −6.05 ± 0.27 dex [ Ni H ] = −0.30 ± 0.27 dex Sr II 4215.519 -1.610 NIST/ASD -8.33 2.97 -9.03 log(Sr/H) = −8.33 ± 0.18 dex [ Sr H ] = 0.70 ± 0.18 dex Y II 3982.592 -0.560 NIST/ASD -8.46 2.24 -9.16 Y II 5662.922 0.340 Bie11 -8.46 log(Y/H) = −8.46 ± 0.17 dex [ Y H ] = 0.70 ± 0.17 dex Zr II 3998.965 -0.520 L06 -8.86 2.60 -9.40 Zr II 4442.992 -0.420 L06 -8.55 Zr II 4457.431 -1.220 L06 -8.55 Zr II 5112.270 -0.850 L06 -8.55 log(Zr/H) = −8.63 ± 0.17 dex [ Zr H ] = 0.77 ± 0.17 dex Ba II 4934.077 -0.156 NIST -8.87 2.13 -9.87 Ba II 6141.713 -0.032 NIST -8.94

Table 2 continued on next page

Table 2 (continued)

Element λ (Å) log gf Ref. log(X/H)_{HR8844} log(X)_⊙ log(X)_⊙ − 12

log(Ba/H) = −8.91 ± 0.25 dex [ Ba H ] = 0.97 ± 0.25 dex La II 4042.91 0.33 Zi99 -9.43 1.17 -10.83 log(La/H) = −9.43 ± 0.25 dex [ La H ] = 1.40 ± 0.25 dex Pr III 5299.99 -0.66 ISAN -8.81 0.71 -11.29 log(P r/H) = −8.81 ± 0.25 dex [ P r H ] = 2.48 ± 0.25 dex Nd III 5265.019 -0.720 RRKB -9.50 1.50 -10.50 log(Nd/H) = −9.50 ± 0.25 dex [ Nd H ] = 1.00 ± 0.25 dex Sm II 4424.32 0.14 LA06 -9.21 1.01 -10.99 log(Sm/H) = −9.21 ± 0.25 dex [ Sm H ] = 1.78 ± 0.25 dex Eu II 4129.70 -0.062 LWHS -10.31 0.51 -11.49 log(Eu/H) = −10.31 ± 0.25 dex [ Eu H ] = 1.18 ± 0.25 dex Tb II 4005.47 -0.02 LA01 no conclusion -0.1 -12.10 Ho II 4152.62 -0.93 LA04 -11.74 (ul) 0.26 -11.74 log(Ho/H) = −11.74 ± 0.25 dex [ Ho H ] = 0.00 ± 0.25 dex Er II 3906.31 0.12 LA08 -9.67 0.93 -11.07 log(Er/H) = −9.67 ± 0.25 dex [ Er H ] = 1.40 ± 0.25 dex Hg II 3983.931 hfs Do03 -6.91 1.09 -10.91 log(Hg/H) = −6.91 ± 0.23 dex [ Hg H ] = 4.00 ± 0.23 dex

Table 3. Elemental Abundances for the comparison stars ν Cap, ν Cnc, Sirius A and HD 72660

Element λ (Å) log(X/H)_{νCap} log(X/H)_{νCnc} log(X/H)_{Sirius} log(X/H)_{HD72660}

He I 4471.470 -1.07 -1.47 -1.77 -2.07 He I 4471.474 -1.07 -1.47 -1.77 -2.07 He I 4471.474 -1.07 -1.47 -1.77 -2.07 He I 4471.485 -1.07 -1.47 -1.77 -2.07 He I 4471.489 -1.07 -1.47 -1.77 -2.07 He I 4471.683 -1.07 -1.47 -1.77 -2.07 He I 5875.598 -1.07 -1.47 -1.77 -2.07 He I 5875.613 -1.07 -1.47 -1.77 -2.07 He I 5875.615 -1.07 -1.47 -1.77 -2.07 He I 5875.625 -1.07 -1.47 -1.77 -2.07 He I 5875.640 -1.07 -1.47 -1.77 -2.07 He I 5875.966 -1.07 -1.47 -1.77 -2.07 Average He I -1.07 -1.47 -1.77 -2.07 C II 4267.001 -3.48 -3.78 -4.00 C II 4267.261 -3.48 -3.78 - 4.30 C II 4267.261 -3.48 -3.78 -4.30 C I 4932.041 -4.00 -4.00 C I 5052.15 -4.08 bl. Average C -3.48 -3.78 -4.04 -4.15 N I 4914.94 -4.02 (u.l) -4.02 (u.l) -4.02 (ul) -4.02 (ul) N I 4935.12 -4.02 (u.l) -4.02 (u.l) -4.02 (ul) -4.02 (ul) Average N I -4.02 -4.02 -4.02 -4.02 O I 5329.673 -3.02 -3.22 -3.47 na O I 5330.726 -3.02 -3.22 -3.44 na O I 5330.741 -3.02 -3.22 -3.44 na O I 6155.961 -3.02 -3.22 -3.63 -3.57 O I 6155.971 -3.02 -3.22 -3.63 -3.57 O I 6155.989 -3.02 -3.22 -3.63 -3.57 O I 6156.737 -3.02 -3.22 -3.63 -3.57 O I 6155.755 -3.02 -3.22 -3.63 -3.57

Table 3 continued on next page

Table 3 (continued)

Element λ (Å) log(X/H)_{νCap} log(X/H)_{νCnc} log(X/H)_{Sirius} log(X/H)_{HD72660}

O I 6156.778 -3.02 -3.22 -3.63 -3.57 O I 6158.149 -3.02 -3.22 -3.63 -3.57 O I 6158.172 -3.02 -3.22 -3.63 -3.57 O I 6158.187 -3.02 -3.22 -3.63 -3.57 Average O I -3.02 -3.22 -3.63 -3.57 Na I 6154.226 -5.07 -4.82 Na I 6160.747 -5.19 –4.97 Average Na I -5.13 -4.89 Mg II 4390.572 -4.42 -4.54 -4.49 -4.42 Mg II 4427.994 -4.42 -4.52 -4.49 -4.34 Mg II 4481.126 -4.42 -4.53 -4.49 -4.38 Mg II 4481.150 -4.42 -4.53 -4.49 -4.38 Mg II 4481.325 -4.42 -4.53 -4.49 -4.38 Average Mg II -4.42 -4.53 -4.49 -4.38 Al II 4663.056 -5.53 -5.68 -5.72 -4.90 Al I 3944.006 -5.53 -5.68 -5.72 bl. Average Al II -5.53 -5.68 -5.72 -4.90 Si II 4128.054 -4.28 -4.25 -4.22 -4.16 Si II 4130.894 -4.28 -4.25 -4.19 -4.16 Si II 4190.72 -4.28 -4.27 -4.15 -4.13 Si II 5041.024 -4.15 -4.15 -4.13 -4.05 Si II 5055.984 -4.32 -4.45 -4.13 -4.16 Si II 5056.317 -4.32 -4.45 -4.13 -4.16 Si II 6347.11 bl. -4.15 -4.11 -4.05 Si II 6371.37 -4.26 -4.45 -4.11 -4.13 Average Si II -4.27 -4.30 -4.15 -4.13 P II 6024.18 -6.55 (ul) -6.55 (ul) bl. bl. P II 6043.13 -6.55 (ul) -6.55 (ul) -6.55 (ul) -6.55 (ul) Average P II -6.55 -6.55 -6.55 -6.55 S II 4153.06 -4.67 (ul) -4.67 -4.44 -4.29 S II 4162.67 -4.67 (ul) -4.67 -4.67 -4.29

Table 3 continued on next page

Table 3 (continued)

Element λ (Å) log(X/H)_{νCap} log(X/H)_{νCnc} log(X/H)_{Sirius} log(X/H)_{HD72660}

Average S II -4.67 -4.67 -4.55 -4.29 Ca II 3933.663 -5.74 -5.86 -6.10 -5.64 Ca II 5019.971 -5.74 -5.86 -6.10 -5.64 Average Ca II -5.74 -5.86 -6.10 -5.64 Sc II 4246.822 -8.95 -7.68 -10.68 -10.65 Sc II 4670.407 -8.95 bl. -10.68 -10.65 Sc II 5031.021 bl. bl. -10.68 -10.65 Sc II 5526.813 -8.95 -7.68 -10.68 -10.65 Average Sc II -8.95 -7.68 -10.68 -10.65 Ti II 4163.644 -6.80 -6.03 -6.70 -6.51 Ti II 4287.873 -6.80 -5.98 -6.70 -6.51 Ti II 4290.210 -6.98 -6.28 -6.80 -6.51 Ti II 4294.090 -6.98 -6.03 -6.72 -6.51 Ti II 4300.042 -6.80 -5.93 -6.68 -6.51 Ti II 4411.072 -6.68 -5.93 -6.58 -6.51 Ti II 4468.492 -7.08 -6.07 -6.84 -6.51 Ti II 4549.622 bl. bl. bl. -6.51 Ti II 4563.758 -6.98 -6.08 -6.72 -6.51 Ti II 5129.156 -6.98 -6.08 -6.75 -6.51 Ti II 5188.687 -6.98 -6.08 -6.75 -6.51 Ti II 5336.780 -6.98 -6.08 -6.75 -6.51 Average Ti II -6.91 -6.05 -6.72 -6.51 V II 4005.71 bl. -7.30 -7.58 -7.40 V II 4023.39 -7.40 -7.30 -7.58 -7.09 V II 4035.63 -7.40 bl. -7.58 -7.40 V II 4036.78 -7.40 -7.30 -7.58 -7.40 Average V II -7.4 -7.30 -7.58 -7.32 Cr II 4558.644 -6.15 -5.55 -5.71 -5.73 Cr II 4558.787 -6.15 -5.55 -5.71 -5.73 Cr II 5237.322 -6.23 -5.55 -5.75 -5.73 Cr II 5308.421 -6.15 -5.63 -5.75 na

Table 3 continued on next page

Table 3 (continued)

Element λ (Å) log(X/H)_{νCap} log(X/H)_{νCnc} log(X/H)_{Sirius} log(X/H)_{HD72660}

Cr II 5313.581 -6.09 -5.55 -5.75 na Cr II 5502.086 -6.15 -5.55 -5.75 -5.86 Average Cr II -6.15 -5.56 -5.74 -5.76 Mn II 4206.368 -6.31 -5.76 -6.09 -6.22 Mn II 4259.19 -6.31 -5.91 -6.09 -6.22 Average Mn II -6.31 -5.83 -6.09 -6.22 Fe II 4233.162 -4.68 -4.42 -4.10 -4.10 Fe II 4258.148 -4.68 -4.42 -4.27 -4.20 Fe II 4273.326 -4.68 -4.42 -4.27 -4.20 Fe II 4296.566 -4.68 -4.42 -4.27 -4.20 Fe II 4491.397 -4.57 -4.44 -4.32 -4.20 Fe II 4508.280 -4.72 -4.50 -4.35 -4.20 Fe II 4515.333 -4.65 -4.30 -4.32 -4.20 Fe II 4520.218 -4.65 -4.35 -4.32 -4.20 Fe II 4522.628 -4.80 -4.50 -4.39 -4.20 Fe II 4549.195 -4.68 bl. bl. bl. Fe II 4549.466 -4.68 bl. bl. bl. Fe II 4555.888 -4.72 -4.50 -4.35 -4.20 Fe II 4923.921 -4.68 -4.42 -4.32 -4.04 Fe II 5275.997 -4.68 -4.42 -4.32 -4.20 Fe II 5316.609 -4.68 -4.42 -4.27 -4.20 Fe II 5506.199 -4.68 -4.42 -4.20 -4.20 Average Fe II -4.68 -4.43 -4.29 -4.18 Co II 4962.36 -7.08 (ul) -7.08 (ul) -7.08 (ul) -7.08 (ul) Co II 4964.17 -7.08 (ul) -7.08 (ul) -7.08 (ul) -7.08 (ul) Average Co II -7.08 -7.08 -7.08 -7.08 Ni II 4679.16 -5.45 -5.15 -4.50 -5.00 Average Ni II -5.45 -5.15 -4.50 -5.00 Sr II 4077.71 -9.03 -7.73 -8.57 -8.33 Sr II 4215.519 -9.03 -7.73 -8.73 -8.33 Average Sr II -9.03 -7.73 -8.65 -8.33

Table 3 continued on next page

Table 3 (continued)

Element λ (Å) log(X/H)_{νCap} log(X/H)_{νCnc} log(X/H)_{Sirius} log(X/H)_{HD72660}

Y II 3982.592 -9.28 -7.16 -9.11 -8.98 Y II 5662.922 -9.28 -7.16 -9.11 -8.98 Average Y II -9.28 -7.16 -9.11 -8.98 Zr II 3991.127 bl. -7.40 bl. -8.52 Zr II 3998.965 bl. -7.40 bl. -8.52 Zr II 4442.992 -8.70 -7.40 bl. -8.32 Zr II 4457.431 -9.40 -7.50 bl. bl. Zr II 4496.962 -9.40 -7.70 -8.67 -8.40 Zr II 5112.270 -9.40 -7.32 -8.67 vw Average Zr II -9.22 -7.45 -8.67 -8.44 Ba II 4554.03 -9.02 -6.93 -8.50 -8.87 Ba II 4934.077 -9.02 -6.93 -8.50 -8.87 Ba II 5853.*** -8.50 -8.76 Ba II 6141.713 -9.02 -6.93 -8.46 -8.79 Average Ba II -9.02 -6.93 -8.49 -8.82 La II 4042.91 -10.83 (ul) -8.83 -9.49 -9.72 Average La II -10.83 -8.83 -9.49 -9.72 Ce II 4460.21 -10.42 (ul) -8.72 -9.34 -9.42 Average Ce II -10.42 -8.72 -9.34 -9.42 Pr II 4222.93 -11.29 (ul.) -9.29 -9.18 Pr III 5284.69 -9.59 Average Pr -11.29 -9.59 -9.29 -9.18 Nd III 5294.10 -10.50 (ul.) -9.20 -9.10 bl. Average Nd III -10.5 -9.2 -9.10 Sm II 4280.79 -10.99 (ul.) -8.29 -8.99 -9.35 Average Sm II -10.99 -8.29 -8.99 -9.35 Eu II 4129.70 -9.61 -10.64 -10.79 Average Eu II -9.61 -10.64 -10.79 Gd II 4037.32 -10.88 (ul.) -8.18 -9.58 -9.48 Average Gd II -10.88 -8.18 -9.58 -9.48

Table 3 continued on next page

Table 3 (continued)

Element λ (Å) log(X/H)_{νCap} log(X/H)_{νCnc} log(X/H)_{Sirius} log(X/H)_{HD72660}

Tb II 4005.47 bl. bl. bl. bl. Tb II 4033.027 bl. bl. bl. bl. Dy II 4000.45 -10.86 (ul.) bl. -9.38 -9.68 Dy II 4077.97 bl. bl. bl. -9.68 Average Dy II -10.86 -9.38 -9.68 Ho II 4045.45 bl. bl. bl. -9.74 Ho II 4152.62 -11.74 (ul.) bl. -10.26 -9.48 Average Ho II -11.74 -10.26 -9.61 Er II 4142.91 bl. -8.17 -9.59 -9.99 Average Er II -8.17 -9.59 -9.99 Tm II 4242.15 bl. bl. bl. -10.0 Average Tm II -10.0 Yb II 4135.095 -10.92 (ul.) -7.44 -10.92 (ul) -8.62 Average Yb II -10.92 -7.44 -10.92 -8.62 Hf II 4417.36 bl. bl. bl. bl. Hf II 3918.08 -9.42 Average Hf II -9.42 Os II 4158.44 -10.55 -6.85 -10.55 -7.55 Average Os II -10.55 -6.85 -10.55 -7.55 Pt II 4514.17 -10.20 (ul.) -7.20 -8.17 bl. Average Pt II -10.20 -7.20 -8.17 Hg II 3983.931 -10.91 (ul.) -7.82 -9.71 -9.20 Average Hg II -10.91 -7.82 -9.71 -9.20

Table 4. Abundance uncertainties for the elements analysed in HR 8844 HeI CII OI MgII AlII SiII SII CaII Δ T_{eff} +200 K -0.30 0.00 0.05 0.047 0.075 -0.017 0.00 0.109 Δ log g 0.15 dex 0.079 0.24 -0.06 -0.052 0.118 -0.017 -0.12 -0/032 Δξt +0.20 km s^{−1} 0.00 0.00 0.00 0.00 0.075 -0.035 -0.046 0.00 Δ log gf +0.10 -0.30 -0.12 -0.16 -0.25 -0.028 -0.053 -0.071 -0.105 Δcontinuum -0.12 0.21 0.075 0.13 0.25 0.062 0.061 0.058 σ_{[X/H]} 0.45 0.34 0.19 0.29 0.20 0.092 0.159 0.165 ScII TiII VII CrII MnII FeII NiII SrII Δ T_{eff} +200 K 0.22 0.041 0.028 0.057 0.00 0.079 0.176 0.138 Δ log g 0.15 dex -0.079 0.015 -0.014 0.03 0.007 0.041 0.114 -0.058 Δξt +0.20 km s^{−1} -0.038 -0.016 0.00 0.00 0.00 -0.095 0.00 -0.058 Δ log gf +0.10 -0.13 -0.23 -0.046 -0.15 -0.015 -0.095 -0.155 -0.058 Δcontinuum 0.067 0.03 0.014 0.046 0.014 0.0126 0.079 0.051 σ_{[X/H]} 0.276 0.064 0.23 0.169 0.076 0.162 0.273 0.178 YII ZrII BaII LaII CeII PrII NdII SmII Δ T_{eff} +200 K 0.146 0.058 0.114 0.11 0.11 0.11 0.11 0.11 Δ log g 0.15 dex 0.046 -0.032 -0.125 -0.13 -0.13 -0.13 -0.13 Δξt +0.20 km s^{−1} 0.00 0.00 -0.097 -0.09 -0.09 -0.09 -0.09 -0.09 Δ log gf +0.10 -0.05 -0.066 -0.125 -0.13 -0.13 -0.13 -0.13 -0.13 Δcontinuum 0.041 0.146 -0.097 -0.09 -0.09 -0.09 -0.09 -0.09 σ_{[X/H]} 0.165 0.173 0.251 0.25 0.25 0.25 0.25 0.25 EuII GdII DyII TbII HoII ErII HgII Δ T_{eff} +200 K 0.11 0.11 0.11 0.11 0.11 0.11 -0.155 Δ log g 0.15 dex -0.13 -0.13 -0.13 -0.13 -0.13 -0.13 0.041 Δξt +0.20 km s^{−1} -0.09 -0.09 -0.09 -0.09 -0.09 -0.09 -0.097 Δ log gf +0.10 -0.13 -0.13 -0.13 -0.13 -0.13 -0.13 -0.108 Δcontinuum -0.09 -0.09 -0.09 -0.09 -0.09 -0.09 0.079 σ_{[X/H]} 0.25 0.25 0.25 0.25 0.25 0.25 0.23

Table 5. Bibliographical references for the atomic data.

Element Bibliographical source

He I Ma60=Martin (1960) He I DR2006=Drake (2006) C II NIST/ASD=Kramida et al. (2017) O I KZ91=Butler, K. & Zeippen, C. J. (1991) O I W96=Wiese et al. (1996) O I NIST/ASD=Kramida et al. (2017)

Table 5 continued on next page

Table 5 (continued)

Element Bibliographical source

Mg II NIST/ASD=Kramida et al. (2017) Mg II NIST/ASD=Kramida et al. (2017) Al II NIST/ASD=Kramida et al. (2017) Al I NIST/ASD=Kramida et al. (2017) Si II NIST/ASD=Kramida et al. (2017) Si II Sh61=Shenstone (1961) S II GUES=Kurucz (1993) S II KP=Kurucz & Peytremann (1975) S II MWRB=Miller et al. (1974) Ca II NIST=”http://physics.nist.gov/PhysRefData/ASD/” Ca II T89=Theodosiou (1989) Sc II NIST/ASD=Kramida et al. (2017) Ti II NIST/ASD=Kramida et al. (2017) Ti II NIST/ASD=Kramida et al. (2017) Ti II NIST/ASD=Kramida et al. (2017) Ti II NIST/ASD=Kramida et al. (2017) V II K10=Kurucz (2010) V II BGF=Biemont et al. (1989) V II WLDSC=Wood et al. (2014) Cr II SN14=Sansonetti & Nave (2014) Mn II KL01=Kling et al. (2001) Fe II NIST/ASD=Kramida et al. (2017) Fe II RU98=Raassen & Uylings (1998) Ni II K03=Kurucz (2003) Sr II PBL95=Pinnington et al. (1995) Y II Bie11=Biémont et al. (2011) Y II MCS75=Meggers et al. (1975a) Zr II L06=Ljung et al. (2006) Ba II NBS=Miles & Wiese (1969) Ba II DSVD92= Davidson et al. (1992) La II Zi99= Zhiguo et al. (1999) Ce II LSCI=Lawler et al. (2009)

Table 5 continued on next page

Table 5 (continued)

Element Bibliographical source

Ce II PQWB=Palmeri et al. (2000) Pr III ISAN=Ryabtsev (2010) Nd III RRKB=Ryabchikova et al. (2006) Sm II LA06= Lawler et al. (2006) Eu II LWHS=Lawler et al. (2001b) Eu II ZLLZ=Zhiguo et al. (2000) Gd II DH06= Den Hartog et al. (2006) Dy II WLN=Wickliffe et al. (2000) Dy II MC=Meggers et al. (1975b) Gd II DH06= Den Hartog et al. (2006) Tb II LA01= Lawler et al. (2001a) Ho II LA04= Lawler et al. (2004) Er II LA08= Lawler et al. (2008) Hg II SR01=Sansonetti & Reader (2001) Hg II Do03=Dolk et al. (2003)

Table 6. Comparison of the derived abundances for HR 8844 derived in this work with the ones of Royer et al. (2014).

Element log(X/H)_{HR8844} this work log(X/H)_{HR8844} (Royer et al. 2014) C -3.880 -3.700 O -3.270 -3.300 Mg -4.770 -4.280 Si -4.510 -4.208 Ca -5.830 -5.823 Sc -8.990 -9.223 Ti -6.830 -7.015 Cr -6.180 -6.098 Fe -4.500 -4.466 Sr -8.330 -8.480 Y -8.460 -9.500 Zr -8.630 -8.900

Table 7. Comparison of the derived abundances for ν Cap, ν Cnc, Sirius A and HD 72660 with previous analyses. A91 refers to Adelman (1991), SD93 to Smith & Dworetsky (1993), A89 to Adelman (1989), L11 to Landstreet (2011), C16 to Cowley et al. (2016) and GL16 to Golriz & Landstreet (2016).

Element log(X/H)_{νCap} A91 and SD93 log(X/H)_{νCnc} A89 log(X/H)_{Sirius} L11 and C16 log(X/H)_{HD72660} GL16 He -1.07 -1.19 -1.47 -1.57 -1.77 -1.24 C -3.48 -3.69 , -3.39 -3.78 -3.88 -4.04 -4.55 -4.15 -4.10 N -4.02 -4.26 -4.02 -4.08 -4.02 -4.70 O -3.02 -3.33 -3.63 -3.60 -3.57 -2.50 Na -5.13 -4.7 Mg -4.42 -4.61 -4.53 -4.71 -4.49 -4.70 -4.38 -4.20 Al -5.53 -6.03 -5.68 -6.38 -5.72 -5.65 -4.90 -4.90 Si -4.27 -4.69 -4.30 -4.59 -4.15 -4.40 -4.13 -4.20 P -6.55 -6.70 -6.55 -7.10 S -4.67 -4.85 -4.67 -5.05 -4.55 -4.80 -4.29 -4.50 Ca -5.74 -5.55 -5.86 -6.06 -6.10 -6.00 -5.64 -5.40 Sc -8.95 -9.34 -7.68 -8.19 -10.68 -10.03 -10.65 -9.50 Ti -6.91 -7.05 -6.05 -6.38 -6.72 -6.90 -6.51 -6.60 V -7.40 -7.64 -7.30 -8.20 -7.58 -7.27 -7.32 -7.20 Cr -6.15 -6.4; -6.13 -5.56 -5.88 -5.74 -5.75 -5.76 -5.65 Mn -6.31 -6.80; -6.69 -5.83 -5.88 -6.09 -6.05 -6.22 -5.90 Fe -4.68 -4.60; -4.47 -4.43 -4.60 -4.29 -4.20 -4.18 -3.75 Co -7.08 -6.7 -7.08 -6.23 -7.08 -6.6 -7.08 -6.50 Ni -5.45 -5.80; -5.67 -5.15 -5.62 -4.50 -5.15 -5.00 -5.15 Sr -9.03 -8.77 -7.73 -8.01 -8.65 -8.57 Y -7.16 -7.76 -9.11 -9.14 -8.98 -7.90 Zr -9.22 -9.36 -7.45 -7.60 -8.67 -8.75 -8.44 -8.30 Ba -9.02 -9.29 -6.93 -6.97 -8.49 -8.40; -8.47 -8.82 -9.65 La -9.49 -9.33 Ce -9.34 -8.92 Pr -9.29 -9.09 Nd -9.10 -9.10 Sm -8.99 8.99 Eu -10.64 -10.19 Gd -8.18 -9.29 -9.58 -9.28 Dy -9.38 -9.16 Ho -10.26 -9.94 Er -9.59 -9.27 Yb -10.92 -9.12 -8.62 -9.00 Os -10.55 -9.55 -7.55 -12 Pt -8.17 -8.60 Hg -7.82 -7.82 -9.71 -9.71 -9.20 -9.20

ALL AUTHORS AND AFFILIATIONS R. Monier^1, LESIA, UMR 8109, Observatoire de Paris et Université Pierre et Marie Curie Sorbonne Universités, place J. Janssen, Meudon.

M. Gebran^2, Department of Physics and Astronomy, Notre Dame University-Louaize, PO Box 72, Zouk Mikael, Lebanon. F. Royer^3, GEPI, Observatoire de Paris, place J. Janssen, Meudon, France.

T. Kilicoglu^4, Department of Astronomy and Space Sciences, Faculty of Science, Ankara University, 06100, Turkey. And Y. Frémat^5.

Royal observatory of Belgium, Dept. Astronomy and Astrophysics, Brussels, 8510, Belgium.