arXiv:1710.03147v1 [eess.SP] 6 Oct 2017

Advanced Satellite-based Frequency Transfer at the 10^{−16} Level

M. Fujieda, S-H. Yang, T. Gotoh, S-W. Hwang, H. Hachisu, H. Kim, Y. K. Lee, R. Tabuchi, T. Ido, W-K. Lee, M-S. Heo, C. Y. Park, D-H. Yu, and G. Petit^{∗†‡}

October 12, 2017

Abstract

Advanced satellite-based frequency transfers by TWCP and IPPP have been performed between NICT and KRISS. We confirm that the disagreement between them is less than 1 × 10^{−16} at an averaging time of several days. Additionally, an intercontinental frequency ratio measurement of Sr and Yb optical lattice clocks was directly performed by TWCP. We achieved an uncertainty at the mid-10^{−16} level after a total measurement time of 12 hours. The frequency ratio was consistent with the recently reported values within the uncertainty.

1 Introduction

Satellite-based time and frequency transfers are in demand for intercontinental links and typically utilize pseudorange measurements using a code phase of a signal modulated by a pseudorandom noise (PN) sequence. Increasing the chip rate of the PN sequence improves the measurement precision, although it occupies a wider frequency bandwidth at the same time. This has limited the measurement precision of two-way satellite time and frequency transfer (TWSTFT) to an insufficient level for the comparison of advanced optical clocks. To improve the precision, the National Institute of Information and Communications Technology (NICT) has developed a two-way carrier-phase satellite frequency transfer (TWCP) [1]. It achieves sub-picosecond-level precision, which is three orders of magnitude better than that of TWSTFT [2]. On the other hand, the precise point positioning (PPP) technique utilizing code and carrier phases has been used by GPS time and frequency transfer (hereafter called GPS transfer) and contributed to the International Atomic Time (TAI) computation [3, 4]. The measurement precision is improved by two orders of magnitude to a few tens of ps by the application of the carrier phase in the GPS transfer. However, solving the phase ambiguity may introduce random errors in GPS transfer results. To overcome this limitation, the integer PPP (IPPP) technique has been developed [5]. It has been applied to GPS transfer and recently demonstrated a 1 × 10^{−16} frequency transfer accuracy [6]. Thus, these advanced satellite-based frequency transfer techniques such as TWCP and IPPP have the potential to enable optical clock comparisons in a very long baseline. Aiming at the evaluation and comparison of their techniques, NICT and the Korea Research Institute of Standards and Science (KRISS) established the TWCP link in December 2016. In this paper, we describe the frequency transfer techniques in Sec. II and introduce the comparison between the two techniques in Sec. III. In Sec. IV, the frequency ratio measurement of Sr and Yb optical lattice clocks by TWCP is demonstrated.

2 Frequency Transfer Techniques and Setups

NICT and KRISS have performed TWCP and GPS transfer on a regular basis. Here, we introduce the TWCP and IPPP techniques briefly. Then their measurement setups at NICT and KRISS are shown.

2.1 TWCP

By two-way signal exchange, the delay terms in the propagation path are almost canceled in TWCP. When we determine a pseudorange from the carrier phase of the transmitted signal from an earth station A at an earth station B, however, we have to remove two terms: the Doppler effects caused by the satellite motion and the phase noise induced

∗M. Fujieda, T. Gotoh, H. Hachisu, R. Tabuchi, T. Ido are with the National Institute of Information and Communications Technology, Koganei, Tokyo, 184-8795 Japan. e-mail: miho@nict.go.jp.

†S-H. Yang, S-W. Hwang, Y. K. Lee, H. Kim, W. K. Lee, M-S. Heo, C. Y. Park, D-H. Yu are with the Korea Research Institute of Standards and Science, Daejeon, 305-600 Korea.

‡G. Petit is with the Bureau International des Poids et Mesures, Sèvres F-92312 France.

by an onboard oscillator in frequency conversion from uplink to downlink frequencies because most of communication satellites do not carry an atomic clock. It was shown in [2] that the mathematical cancellation by using four carrier phases of the four signals from A to A, from A to B, from B to A, and from B to B is effective in removing them. Additionally, the ionosphere delay is not canceled either because the uplink and downlink frequencies are different. Therefore, we utilize an ionosphere map and compute the delays using the total electron contents (TECs) over the earth stations. Since the carrier phase is continuously tracked and accumulated in TWCP measurement without any fixation of phase ambiguity, the result basically keeps the continuity as long as the measurement continues. Figures 1 (a) and (b) show schematics of the earth stations at NICT and KRISS, respectively. We use an arbitrary waveform generator for the signal generation and an analogue-to-digital (A/D) sampler for carrier-phase detection. The TWCP signal has a frequency bandwidth of 200 kHz. The code phase of 128 k chips per second (cps) is detected, as well as the carrier phase, and it helps the signal tracking. The frequency conversion is carried out by commercial frequency up- and downconverters from 70 MHz to uplink and downlink frequencies of 14 and 11 GHz, respectively. The reference signals of 10 MHz are provided to the frequency converters to maintain the carrier phase coherence. At NICT, a dedicated earth station is used for the TWCP measurement. On the other hand, at KRISS, the TWCP and conventional TWSTFT measurements share one earth station. The two signals for the TWCP and TWSTFT are combined and divided at 70 MHz by a signal combiner and divider, respectively. Figure 1 (c) shows the reception spectrum where the same center frequency was used by the TWCP signal and the TWSTFT signal with a bandwidth of 2.5 MHz. We did not observe any interference between them caused by sharing the same frequency bandwidth. We started continuous TWCP measurement alongside TWSTFT in December 2016 using a geostationary satellite named Eutelsat 172A. For the ionosphere delay correction between NICT and KRISS, we use a global ionosphere map produced by the Center for Orbit Determination in Europe (CODE) [7]. The typical amplitude of the ionosphere delay is about 10 ps.

2.2 IPPP

In IPPP, as in classical PPP, the user’s clock is determined from dual frequency GPS phase measurements using satellite clock products generated by analysis of a global network. For IPPP, the satellite products generated by the GRG analysis centre [8] are designed so that the user can determine the phase ambiguities for each satellite pass and the two frequencies as integers N1/N2. This is done in a two-step procedure with the CNES GINS software, first determining the widelane ambiguity Nw = N2 - N1 and then determining e.g. N1, see details in [6, 8]. Clock differences are then continuous as long as there is no discontinuity in the set of integer ambiguities for all satellite passes.

As shown in [6], the above treatment is performed on a station by station basis, independently for each day, and the continuity between successive daily batches is then to be established. By design, discontinuities between batches should be an integer number of the so-called narrowlane wavelength λ_N (∼350 ps) and it is simpler to determine these discontinuities when forming the difference of two station clocks, i.e. a time link. Indeed, when the instability of the two compared clocks is sufficiently low, the extrapolation noise from batch to batch is much lower than λ_N and it is easy to determine the discontinuities as an integer number of λ_N . This extrapolation technique was used for the IPPP solution between UTC(NICT) and UTC(KRIS) which are both based on H-masers. Note that such discontinuities must also be determined when all satellite ambiguities are reset within a daily batch, e.g. by a short data gap. The GPS receivers used at NICT and KRISS are Septentrio PolaRx 4 and Ashtech Z12T connected to the reference signals from UTC(NICT) and UTC(KRIS), respectively.

3 Comparison between TWCP and IPPP

We compared the measurement results obtained by PPP, IPPP, and TWCP for two periods: (1) from MJD 57772 to MJD 57784 and (2) from MJD 57851 to MJD 57883. Here, PPP is computed with NRCan PPP software using 15 days batch and IGS final products. The TWCP measurements were continuously carried out without any downtime. The measurement rates of PPP, IPPP, and TWCP are 300, 30, and 1 s, respectively. Figure 2 (a) shows the time difference between UTC(NICT) and UTC(KRIS) for period (2). For better visibility, offset values are inserted. Figure 2 (b) shows the double differences of IPPP-TWCP and PPP-TWCP. A time jump can be observed at MJD 57861. It is clear that the TWCP result causes it because the signal-to-noise ratio at the KRISS station suddenly decreased by 8 dB owing to heavy rain, and a phase excursion of 0.2 ns occurred in the TWCP result. Additionally, a small jump can be seen at MJD 57856. It was found that the GPS receiver at NICT caused a reset of all ambiguities at that time. While IPPP found an exact integer number of cycles to go through the reset, PPP could not. Furthermore, the double difference of PPP-TWCP indicates a clear gradient, which can also be seen in the result for period (1). We assume that the gradients show disagreements among the techniques, and they are summarised in Table 1. IPPP and TWCP show consistency at the 10^{−17} level. Figure 3 shows the modified Allan deviation of UTC(NICT)-UTC(KRIS) for period (2). The stabilities longer than 1 day are limited by those of the time scales. The double differences

Figure 1: Schematics of the earth stations at (a) NICT and (b) KRISS. BPF: band-pass filter, amp.: amplifier, A/D: analogue-to-digital converter. (c) Spectrum of the reception signals for TWCP and TWSTFT.

Figure 2: (a) Time difference between UTC(NICT) and UTC(KRIS), (b) double differences of IPPP-TWCP and PPP-TWCP.

of IPPP-TWCP and PPP-TWCP are free from the limitation. While the curve of IPPP-TWCP is decreasing and reaches 10^{−17} level after 500,000 s, that of PPP-TWCP becomes flat. For period (1), similar stabilities are achieved of 5.5 × 10^{−17} at 250,000 s for IPPP-TWCP and 1.7 × 10^{−16} at 250,000 s for PPP-TWCP. By the comparisons among PPP, IPPP, and TWCP, it proved that TWCP, as well as IPPP, has superior long-term stability. Until now, unless the signal-to-noise ratio decreases suddenly owing to the weather conditions, the measurement has successfully continued and phase continuity can be preserved in the TWCP results.

Figure 4 shows the time differences of UTC(NICT)-UTC(KRIS) free from the time-scale variation, from which its two-day moving average is subtracted and then the remainder is averaged over 1 hour. As shown in Figure 4 (a), IPPP and PPP indicate some variations with periods of one day and half a day. Examination of each receiver’s data shows that both receivers have one-day-period components. In Figure 4 (b), the time difference for TWCP is depicted together with the outdoor temperature at NICT. Since the diurnal change of outdoor temperature at KRISS is similar to that of NICT, it is not shown. The fluctuation in TWCP is smaller than those of IPPP and PPP. However, TWCP also shows one-day-period variation with an amplitude of 10 ps order. The ionosphere delays have already been compensated. The variation sometimes shows a weak inverse correlation with the outdoor temperature, for example, around April 25, 2017. Additionally, the variation around April 20, 2017 seems to have a positive correlation. We recently moved the outdoor power amplifier and low-noise amplifier into a temperature-stabilized box at the NICT earth station. Further analysis of the effect will be carried out in the near future.

4 Yb/Sr Frequency ratio measurement by TWCP

4.1 Measurement Setup

NICT and KRISS operate a^{87}Sr optical lattice clock [9, 10] and an^{171}Yb optical lattice clock [11]. The frequency ratio was measured by TWCP through microwave references. The optical clocks were continuously operated for around 4 hours per day over 3 days during February 1-3, 2017. We performed two local measurements and one TWCP measurement at the same time. The frequencies of optical clocks were measured with reference to the microwave references by using an optical frequency comb at each site. The systematic frequency shifts of the optical clock were corrected including the gravitational redshift. TWCP evaluates the frequency difference between the microwave references of both sites. At NICT and KRISS, a hydrogen maser, HM(NICT), and UTC(KRIS) with frequency f_{HM(NICT)} and f_{UTC(KRIS)}, respectively, were used as the microwave references. These signals were provided to the earth stations for TWCP. By obtaining fractional frequencies y_{Yb} and y_{Sr} against each result of previous absolute frequency measurements f_{Yb} and f_{Sr} [11, 10] on the basis of f_{UTC(KRIS)} and f_{HM(NICT)}, the frequency ratio of the two optical clock transitions ν_{Yb}/ν_{Sr} is measured as

ν_{Yb} ν_{Sr} = y_{Yb} y_{Sr} · f_{Yb} f_{Sr} = f_{HM(NICT)} f_{Sr}/f_{Sr} · f_{UTC(KRIS)} f_{HM(NICT)} · f_{Yb}/f_{Yb} f_{UTC(KRIS)} · f_{Yb} f_{Sr} (1) 4.2 Data analysis

The data acquisition rates of the two local measurements and one TWCP measurement were 1 point per every second. First, we extracted the data where both optical clocks were simultaneously operated. Figure 5 (a) depicts their Allan deviations measured on Feb. 1. The HM(NICT) signal was transferred by an unfixed coaxial cable to the Sr clock at this measurement, which caused an unwanted fluctuation and instability at around 100 s. Since the stabilities shown in Figure 5 (a) display similar values around 30 s, we averaged three frequency ratios over 30 s, aligned the time stamps, and then calculated y_{Yb}/y_{Sr} following (1). The computed difference relative to f_{Yb}/f_{Sr} is depicted in Figure 5 (b). The Allan deviation was calculated from the lumped data for 3 days as shown in Figure 5 (c) by a red line, where the fitting curve of 9.4 × 10^{−13} × t^{−0.72} is also depicted by a blue line. Table 2 summarises the daily mean values. Weighting the daily mean values by the number of 30-s points divided by the square of the daily standard deviation, we concluded the weighted frequency difference of 4.9 × 10^{−16} for the 3-day measurement. As for the daily statistical uncertainty, it was computed using the fitting curve of the Allan deviation for the measurement period. Table 3 shows the uncertainty budget. The total statistical uncertainty was determined using the mean of the daily statistical uncertainties divided by the square root of three: ((9.7^2 + 9.1^2 + 9.6^2)/3/3)^{0.5} × 10^{−16}. In Figure 5 (c), the Allan deviation of f_{HM(NICT)}/f_{UTC(KRIS)} measured by TWCP for 3 days is depicted by the green line, which meets the fitting curve at 5 × 10^{−16} around 40,000 s. This implies that the total statistical uncertainty was estimated appropriately. The systematic uncertainty for TWCP was 1×10^{−16} from the disagreement with IPPP. On the other hand, the Sr and Yb lattice clocks have systematic uncertainties of 0.5 × 10^{−16} and 1.2 × 10^{−16}, respectively. The uncertainties of the

Figure 3: Modified Allan deviation of UTC(NICT)-UTC(KRIS) from MJD 57851 to 57883.

Table 1: Disagreement between PPP, IPPP and TWCP

Period Difference Disagreement (10^{−16}) (1) IPPP-TWCP -0.43 MJD 57772-57784 PPP-TWCP 3.8 (2) IPPP-TWCP -0.66 MJD 57851-57883 PPP-TWCP 5.9

Figure 4: Time difference free from time-scale variation: (a) IPPP and PPP, (b) TWCP and outdoor temperature at NICT.

Figure 5: (a) Allan deviations of two local measurements and one TWCP measurement carried out on Feb. 1. (b) Frequency difference of y_{Yb}/y_{Sr} − 1 for 3 days. (c) Lumped Allan deviation of y_{Yb}/y_{Sr}, its fitting curve and the Allan deviation of f_{HM(NICT)}/f_{UTC(KRIS)} measured from Feb. 1-3. (d) Frequency ratio R reported so far.

differential gravitational redshift between both clocks is 0.4 × 10^{−16}. We achieved a total uncertainty of 5.8 × 10^{−16}. Thus, the consistency of the previous absolute frequencies reported by NICT and KRISS [10, 11] was confirmed by y_{Yb}/y_{Sr} − 1 = (4.9 ± 5.8) × 10^{−16}. We concluded the frequency ratio, R, as R = ν_{Yb}/ν_{Sr} = 1.207, 507, 039, 343, 337, 86(70).

The recently reported values are shown in Figure 5 (d) [12, 13]. We confirm that our result is consistent with them within the uncertainty.

5 Conclusion

We evaluated measurement results achieved by the advanced satellite-based frequency techniques of PPP, IPPP, and TWCP in the NICT-KRISS link. While the disagreement of PPP-TWCP remains at the 10^{−16} level, that of IPPP- TWCP reaches the 10^{−17} level at over 5 × 10^5 s average time.

The intercontinental frequency ratio measurement of Sr and Yb optical lattice clocks was directly performed by TWCP. We performed a dead-time-free and simultaneous measurement for about 12 hours and confirmed that the achieved frequency ratio is consistent with those shown in other reports within a total uncertainty at the mid-10^{−16} level. In conclusion, not only optical fiber links but also advanced satellite-based frequency links are applicable to optical clock comparisons. The satellite-based techniques have the potential to realize uncertainty at the 10^{−17} level when optical clocks are continuously operated for a week or more.

Acknowledgement

The authors would like to thank H. Takiguchi now in JAXA for his technical support in PPP. The use of the GINS software from the CNES and of the GPSPPP software from the NRCan is gratefully acknowledged.

References

[1] M. Fujieda et al., “NICT-KRISS TWCP link: evaluation and application,” Abstract of the 2017 Joint Conference of the European Frequency and Time Forum and the IEEE International Frequency Control Symposium, Jul. 2017.

[2] M. Fujieda, D. Piester, T. Gotoh, J. Becker, M. Aida, and A. Bauch, “Carrier-phase two-way satellite frequency transfer over a very long baseline”, Metrologia, 51, 253-262, 2014.

[3] K. M. Larson and J. Levine, “Carrier-phase time transfer,” IEEE Trans. Ultrason. Ferroelectr. Freq. Cont., vol.

46, no. 4, pp. 1001-1012, 1999.

[4] G. Petit and Z. Jiang, “Precise point positioning for TAI computation,” Proc. of IEEE International Frequency Control Symposium Jointly with the 21^{st} European Frequency and Time Forum, pp. 395-398, 2007.

[5] D. Laurichesse and F. Mercier, “Integer ambiguity resolution on undifferenced GPS phase measurements and its application,” Proc. of PPP ION GNSS 20^{th} Int. Technical Meeting of the Satellite Division, Sep. 2007.

[6] G. Petit et al., “1 10^{−16} frequency transfer by GPS PPP with integer ambiguity resolution,” Metrologia, 52, 301-309, 2015.

[7] Global Ionosphere Maps Produced by the Center of the Orbit Determination (CODE), [Online]. Available:

http://aiuws.unibe.ch/ionosphere/

[8] S. Loyer et al., “Zero-difference GPS ambiguity resolution at CNES-CLS IGS Analysis Center,” Journal of Geodesy, 86, 991-1003, 2012.

[9] H. Hachisu, G. Petit, and T. Ido, “Absolute frequency measurement with uncertainty below 1 × 10^{−15} using International Atomic Time,” Appl. Phys. B, 123:34, 2017.

[10] H. Hachisu et al., “SI-traceable measurement of an optical frequency at the low 10^{−16} level without a local primary standard,” Opt. Express, 25, 8, 8511, 2017.

[11] H. Kim, M.-S. Heo, W.-K. Lee, C. Y. Park, H.-G. Hong, S.-W. Hwang, and D.-H. Yu, “Improved absolute frequency measurement of the^{171}Yb optical lattice clock at KRISS relative to the SI second,” Jpn. J. Appl. Phys., 56, 050302, 2017.

[12] N. Nemitz et al., “Frequency ratio of Yb and Sr clocks with 5 × 10^{−17} uncertainty at 150 seconds averaging time,” Nat. Photonics, 10, 258, 2016.

[13] J. Grotti et al., “Geodesy and metrology with a transportable optical clock,” arXiv: 1705.04089, 2017.

Table 2: Daily Mean Values

Feb. 1 Feb. 2 Feb. 3 y_{Yb}/y_{Sr} − 1 (10^{−15}) 0.33 1.00 0.17 Std. Dev. (σ)(10^{−15}) 57.60 60.13 54.85 No. of 30-s points (N) 479 517 477 Measurement period (s) 14370 15510 14310 Daily statistical uncertainty (10^{−15}) 0.97 0.91 0.96 Weighted mean (10^{−15}) 0.49

Table 3: Uncertainty Budget

(10^{−16}) Statistical 5.5 Sr systematic 0.5 Yb systematic 1.2 Gravitational redshifts 0.4 Link systematic 1.0 Total 5.8