arXiv:1705.06930v1 [astro-ph.SR] 19 May 2017

Accepted in The Astrophysical Journal, 2017 Preprint typeset using L^ATEX style emulateapj v. 04/20/08

X-RAY SUPERFLARES ON CC ERI

Subhajeet Karmakar^{1,2*}, J. C. Pandey^1, V. S. Airapetian^3, and Kuntal Misra^1 1 Aryabhatta Research Institute of observational sciencES (ARIES), Nainital 263002, India 2 Pt. Ravishankar Shukla University, Raipur 492010, India and 3 NASA Goddard Space Flight Center, 8800 Greenbelt Road, Greenbelt, Maryland 20771, USA Accepted in The Astrophysical Journal, 2017

ABSTRACT We present an in-depth study of two superflares (F1 and F2) detected on an active binary star CC Eridani by the Swift observatory. These superflares triggered the Burst Alert Telescope (BAT) in the hard X-ray band on 2008 October 16 and 2012 February 24. The rise phases of both the flares were observed only with BAT, whereas the decay phases were observed simultaneously with the X-ray Telescope. It has been found that the flares decay faster in the hard X-ray band than in the soft X-ray band. Both flares F1 and F2 are highly energetic with respective peak X-ray luminosities of ∼10^{32.2} and ∼10^{31.8} erg s^{−1} in 0.3–50 keV energy band, which are larger than any other flares previously observed on CC Eri. The time-resolved spectral analysis during the flares shows the variation in the coronal temperature, emission measure, and abundances. The elemental abundances are enhanced by a factor of ∼8 to the minimum observed in the post-flare phase for the flare F1. The observed peak temperatures in these two flares are found to be 174 MK and 128 MK. Using the hydrodynamic loop modeling, we derive loop lengths for both the flares as 1.2±0.1×10^{10} cm and 2.2±0.6×10^{10} cm, respectively. The Fe Kα emission at 6.4 keV is also detected in the X-ray spectra and we model the Kα emission feature as fluorescence from the hot flare source irradiating the photospheric iron. These superflares are the brightest, hottest, and shortest in duration observed thus far on CC Eri. Subject headings: stars: activity, – stars: coronae, – stars: flare, – stars: individual (CC Eri), – stars: magnetic

1. INTRODUCTION

Flares on the Sun and solar-type stars are generally interpreted as a rapid and transient release of magnetic energy in coronal layers driven by reconnection processes, associated with electromagnetic radiation from radio waves to γ-rays. As a consequence, the charge particles are accelerated and gyrate downward along the magnetic field lines, producing synchrotron radio emission, whereas these electron and proton beams collide with the denser material of the chromosphere and emit in hard X-rays (>20 keV). Simultaneous heating of plasma up to tens of MK evaporates the material from the chromospheric footpoints, which in turn increases the density on newly formed coronal loops emitting at extreme UV and X-rays. Since the non-flaring coronal emission only contains the information about an optically thin, multi-temperature, and possibly multi-density plasma in coronal equilibrium; therefore, it is very important to understand the dynamic behavior of the corona flaring events. Extreme flaring events are even more useful to understand the extent to which the dynamic behavior can vary within the stellar environments.

The typical total energy of solar flares ranges from 10^{29−32} erg, whereas the flares on normal solar-type stars, having a total energy range of 10^{33−38} erg, are generally termed as “superflares” (Schaefer et al., 2000; Shibayama et al., 2013). In the past, X-ray superflares have been observed and analyzed in the late-type stars Algol (Favata & Schmitt, 1999), AB Dor (Maggio et al., 2000), EV Lac (Favata et al., 2000; Osten et al., 2010),

* subhajeet@aries.res.in

UX Ari (Franciosini et al., 2001), II Peg (Osten et al., 2007), and DG CVn (Fender et al., 2015). Recent observations of X-ray superflares reveal an important aspect of the detection of iron Kα fluorescence emission during flaring events (Ercolano et al., 2008; Testa et al., 2008). Previously, this iron Kα fluorescence emission line was detected on the solar flares (Parmar et al., 1984; Zarro et al., 1992). The X-ray emissions during the solar and stellar flares interact with the photospheric layers and become reprocessed through scattering and photoionization. These processes also produce characteristic fluorescent emission from astrophysically abundant species.

In this paper, we describe two superflares serendipitously observed by the Swift observatory on an active spectroscopic binary star CC Eri. This binary consists of a K7.5Ve primary and M3.5Ve secondary (Amado et al., 2000), and is located at a distance of ∼11.5 pc. With a mass ratio ≈2 (Evans, 1959), the system is tidally locked and the primary component is one of the fastest rotating K dwarfs in the solar vicinity with a rotation period of 1.56 day. Demircan et al. (2006) estimated the age of the CC Eri system to be 9.16 Gyr. The chromospheric emission was found to vary in anti-phase with its optical continuum, suggesting the association of active emission regions with starspots (Busko et al., 1977; Amado et al., 2000). The polarization of the quiescent radio emission was found to be 10–20% (Osten et al., 2002; Slee et al., 2004), which implies the presence of a large-scale magnetic field. The first X-ray detection was done with HEAO1 showing X-ray luminosity (L_X) of 10^{29.6} erg s^{−1} in the 2–20 keV energy band (Tsikoudi, 1982). Later several X-ray observations were made with other

2 Karmakar et al.

satellites such as Einstein IPC (Caillault et al., 1988) and EXOSAT (Pallavicini et al., 1988). Using XMM- Newton observations, the quiescent state coronae of CC Eri were well described by two-temperature plasma models (∼3 and ∼10 MK) with a luminosity of ∼10^{29} erg s^{−1} in 0.3–10 keV energy band (Pandey & Singh, 2008). CC Eri has a record of frequent flaring activity observed across a wide range of the electromagnetic spectrum. The first ever X-ray flare on CC Eri was detected with the ROSAT satellite (Pan & Jordan, 1995). Later several X-ray flares were detected with XMM-Newton (Crespo-Chacón et al., 2007; Pandey & Singh, 2008), Chandra (Nordon & Behar, 2007), Swift (Evans et al., 2008; Barthelmy et al., 2012), and MAXI GCS (Suwa et al., 2011). Among the previously observed flares, the largest one was observed with Chandra, having a peak X-ray flux that is ∼11 times more than that of the quiescent value. Superflares from CC Eri are expected to be driven by strong surface magnetic fields as estimated by Bopp & Evans (1973).

The paper is organized as follows. Observations and the data reduction procedure are discussed in § 2. Analysis and results from X-ray timing and spectral analysis along with the time-resolved spectroscopy, loop modeling, and Fe Kα modeling are discussed in § 3. Finally, in § 4, we discuss our results and present conclusions.

2. OBSERVATIONS AND DATA REDUCTION

2.1. BAT Data

The flare F1 triggered Swift’s Burst Alert Telescope (BAT; Barthelmy et al., 2005) on 2008 October 16 UT 11:22:52 (=T 0_1) during a preplanned spacecraft slew. The flare F2 was detected as an Automatic Target triggered on board on 2012 February 24 UT 19:05:44 (=T 0_2). We have used BAT pipeline software within FTOOLS^2 version 6.20 with the latest CALDB version ‘BAT (20090130)’ to correct the energy from the efficient but slightly non-linear on board energy assignment. BAT light curves were extracted using the task batbinevt. For the spectral data reported here, the maskweighted spectra in the 14–50 keV band were produced using batmaskwtevt and batbinevt tasks with an energy bin of 80 channels. The BAT ray tracing columns in spectral files were updated using the batupdatephakw task, whereas the systematic error vector was applied to the spectra from the calibration database using the batphasyserr task. The BAT detector response matrix was computed using the batdrmgen task. The sky images in two broad energy bins were created using batbinevt and batfftimage, and flux at the source position was found using batcelldetect, after removing a fit to the diffuse background and the contribution of bright sources in the field of view. The spectral analysis of all the BAT spectra was done using the X-ray spectral fitting package (xspec; version 12.9.0n; Arnaud, 1996). All the errors associated with the fitting of the BAT spectra were calculated for a confidence interval of 68% (Δχ^2 = 1). [t] 2 The mission-specific data analysis procedures are provided in FTOOLS software package; a full description of the procedures mentioned here can be found at https://heasarc.gsfc.nasa.gov/docs/software/ftools/ftools menu.html

2.2. X-Ray Telescope (XRT) Data

Flaring events F1 and F2 were observed by the X-ray telescope (XRT; Burrows et al., 2005) from T 0_1+147.2 and T 0_2+397.5 s, respectively. The XRT observes in the energy range of 0.3–10 keV using CCD detectors, with the energy resolution of ≈ 140 eV at the Fe K (6 keV) region as measured at launch time. In order to produce the cleaned and calibrated event files, all the data were reduced using the Swift xrtpipeline task (version 0.13.2) and calibration files from the latest CALDB version ‘XRT (20160609)’ release^3. The cleaned event lists generated with this pipeline are free from the effects of hot pixels and the bright Earth. In the case of flare F1, due to the large XRT count rate, the initial data recording was in Windowed Timing (WT) mode; whereas from T 0_1 + 11.7 s until the end of the observation ( T 0_1 + 31.1 s), data were taken in Photon Counting (PC) mode. The flare F2 was observed only in WT mode after T 0_2 for 1.2 ks. From the cleaned event list, images, light curves, and spectra for each observation were obtained with the xselect (version 2.4d) package. We have used only grade 0–2 events in WT mode and grade 0–12 events in PC mode to optimize the effective area and hence the number of collected counts. Taking into account the point-spread function correction (PSF; Moretti et al., 2005) as well as the exposure map correction, the ancillary response files for the WT and PC modes were produced using the task xrtmkarf. In order to perform the spectral analysis, we have used the latest response matrix files (Godet et al., 2009), i.e. swxwt0to2s6 20010101v015.rmf for the flare F1 and swxwt0to2s6 20110101v015.rmf the flare F2 in WT mode and swxpc0to12s6 20010101v014.rmf for flare F1 in PC mode. All XRT spectra were binned to contain more than 20 counts bin^{−1}. The spectral analysis of all the XRT spectra was carried out in an energy range of 0.3–10 keV using xspec. All the errors of XRT spectral fitting were estimated with a 68% confidence interval (Δχ^2 = 1), equivalent to ±1σ. In our analysis, the solar photospheric abundances (Z_⊙) were adopted from Anders & Grevesse (1989), whereas, to model N_H, we used the cross-sections obtained by Morrison & McCammon (1983).

While extracting the light curve and spectra, we took great care in order to correct the data for the effect of pile-up in both WT and PC modes. At high observed count rates in WT mode (several hundred counts s^{−1}) and PC mode (above 2 counts s^{−1}), the effects of pileup are observed as an apparent loss of flux, particularly from the center of the PSF and a migration from 0–12 grades to higher grades and energies at high count rates. To account for this effect, the source region of WT data were extracted in a rectangular 40 × 20 pixel region (40 pixels long along the image strip and 20 pixels wide; 1 pixel = 2.^{′′}36) with a region of increasing size (0 × 20–20 × 20 pixels) excluded from its center, whereas the background region was extracted as 40 × 20 pixel region in the fainter end of the image strip. We produced a sample of grade ratio distribution using background-subtracted source event lists created in each region. The grade ratio distribution for the grade 0 event is defined as the ratio

3 See http://heasarc.gsfc.nasa.gov/docs/heasarc/caldb/swift/

CC Eridani 3

(a) Observations in 2008 shows flare F1 with a post-flare (PF) region

(b) Observations in 2012 shows flare F2

Fig. 1.— X-ray light curves of the flares (a) F1 and (b) F2 of CC Eri. Temporal binning for BAT light curves is 50 and 80 s for flares F1 and F2, respectively, whereas the binning for XRT light curves is 10 s for both flares. Dashed vertical lines indicate the trigger time, whereas dotted vertical lines show the time intervals for which time-resolved spectroscopy was performed. The time intervals are represented by P_i, where i = 1 – 11 for F1 and 1– 6 for F2.

of the grade 0 event over the sum of grade 0–2 events per energy bin in the 0.3–10 keV energy range. Comparing the grade ratio distribution with that obtained using non-piled-up WT data, in order to estimate the number of pixels to exclude, we find that an exclusion of the innermost 5 pixels for F1 and 3 pixels for F2 were necessary when all the WT data are used. In order to carry out a more robust analysis for pile-up corrections, we also fit the spectra with an absorbed power law. The hydrogen column density N_H was fixed to the values that were obtained from the fit of the non-piled-up spectrum (exclusion of innermost 20 pixels was assumed to be unaffected by piled-up). This gives similar results of exclusion of the innermost pixels within its 1σ value. In PC mode, since the pile-up affects the center of the source radial PSF, we fit the wings of the source radial PSF profile with the XRT PSF model (a King function; see Moretti et al., 2005) excluding 15 pixels from the center

4 Karmakar et al.

Fig. 2.— Combined XRT and BAT spectra near the peak phase of flare F1 (i.e. part P3) are shown as representative spectra. In the top panel, the XRT and BAT spectra are shown with solid squares and solid circles, respectively, whereas the best-fit apec 3-T model is over-plotted with a continuous line. The bottom panel plots the ratio between data and model. The inset of the top panel shows a close-up view of the Fe Kα complex, where the 6.4 keV emission line is fitted with a Gaussian. The contribution of apec component and the Gaussian component is shown by dashed lines.

and then extrapolated to the inner region. The PSF profile of the innermost 4 pixels was found to deviate from the King function, the exclusion of which enables us to mitigate the effects of pile-up from PC mode data.

3. RESULTS AND ANALYSIS

3.1. X-Ray Light Curves

X-ray light curves of CC Eri obtained in 0.3–10 keV and 14–150 keV energy bands are shown in Fig. 1. The BAT observation in 2008, which began at T 0_1–243 s, shows a rise in intensity up to T 0_1+100 s, where it reached a peak intensity with a count rate of 0.024±0.005 counts s^{−1}, which is ∼24 times higher than the minimum observed count rate. A sharp decrease in intensity up to nearly T 0_1+450 s was observed followed by a shallower decay until the end of the BAT observations at ∼T 0_1+950 s. The XRT count rate of flare F1 was already declining as it entered the XRT field of view at T 0_1+142 s. The peak XRT count rate for the pile-up corrected data was found to be 437±7 counts s^{−1}, which was ∼100 counts s^{−1} lower than the previously reported count rate (Evans et al., 2008). Flare F1 survived for the entire WT mode of observation of 1.8 ks, after that the observation was switched over in PC mode where count rates were found to be constant and marked as ‘PF’ in Fig. 1(a). The BAT observation of flare F2, which began at T 0_2–240 s, shows a rise in intensity and peaked around T 0_2, followed by a decline in intensity until the end of the BAT observation. The peak BAT count rate for flare F2 was found to be ∼0.004 counts s^{−1}, which was ∼4 times more than the minimum count rate observed. The flare ‘F2’ was also already declining when it entered in the XRT field of view with a pile-up corrected peak count rate of 99±2 counts s^{−1}. The XRT count rates at the peak of the flares F1 and F2 were found to be 474 and 108 times more than the minimum observed count rates, respectively. The durations of the flares were more than 2.2 for F1 and 1.8 ks for F2. The e-folding rise times (τ_r) of the flares F1 and F2 derived from BAT data were found to be 150±12 and 146±34 s, respectively; whereas e-folding decay times (τ_d) with BAT and XRT data were found to be 283±13 and 539±4 s for flare F1 and 592±114 and 1014±17 s for flare F2, respectively. This indicates a faster decay in the hard X-ray band than in the soft X-ray. Both flaring events were clearly identified in the energy band of 14–50 keV, but they were barely detectable above 50 keV.

3.2. BAT Spectral Analysis

Spectral parameters during the flares evolve with time as flare emission rises, reaches its peak, and later decays similarly to the X-ray light curve. Therefore, in order to trace the spectral change, we have divided the BAT light curve of the flare F1 into nine time segments and extracted the spectra of each segment, whereas we could not divide the flare F2 into any further segments due to poor statistics. The combined BAT and XRT spectra near the peak phase of the flare F1 (i.e. part P3) of CC

CC Eridani 5

(i) Flare F1 (ii) Flare F2

Fig. 3.— Evolution of spectral parameters of CC Eri during the flares F1 (i) and F2 (ii). Parameters derived with the XRT, BAT, and XRT+BAT spectral fitting in all the panels are represented by the solid diamonds, solid stars, and solid squares, respectively. In the top panel (a), the X-ray luminosities are derived in 0.3–10 keV (solid diamond) and 14–50 keV (solid star and solid squares) energy bands. For the first two segments, BAT luminosity derived in the 14–50 keV energy band is extrapolated to the 0.3–10 keV energy band (solid triangles). The dashed–dotted and dotted horizontal lines correspond to bolometric luminosity of the primary and secondary components of CC Eri, respectively. Panels (b)–(e) display the variations of plasma temperature, EM, abundance, and Fe Kα line flux, respectively. The dashed vertical line indicates the trigger time of the flares F1 and F2. Horizontal bars give the time range over which spectra were extracted; vertical bars show a 68% confidence interval of the parameters.

Eri are shown in Fig. 2. The dotted vertical lines in the top panel of Fig. 1(a) indicate the time intervals during which BAT spectra were accumulated. In this section, we analyze those time segments where only the BAT observations were available, i.e. the first two time segments for flare F1 (P1 and P2), and only one for flare F2. The hard X-ray spectra were best-fitted using single temperature Astrophysical Plasma Emission Code (apec; see Smith et al., 2001) as implemented for collisionally ionized plasma. The addition of another thermal or nonthermal component does not improve the fit-statistics. Since the standard apec model included in the xspec distribution only considers emission up to photon energies of 50 keV; therefore, we restricted our analysis in 14–50 keV energy band. The abundances in this analysis were fixed to the mean abundances derived from XRT spectral fitting (see § 3.3) given in a multiple of the solar values of Anders & Grevesse (1989). The galactic Hi column density (N_H) in the direction of CC Eri is calculated according to the survey of Dickey & Lockman (1990) and kept fixed at the value of 2.5×10^{20} cm^{−2}. The unabsorbed X-ray fluxes were calculated using the cflux model. The variation in hard X-ray luminosity (L_{X,[14−50]}), plasma temperature (kT ), emission measure (EM), and abundances (Z) derived from the BAT spectra are illustrated in Fig. 3 and given in Table 4. The peak

TABLE 1 Spectral Parameters Derived for the Post-flare Emission of CC Eri from Swift XRT PC mode Spectra During the Time Interval “PF” As Shown in Fig. 1 Using apec 2-T and apec 3-T Models.

Parameters 2T 3T N_H (10^{20} atoms cm^{−2}) 0.9^{+0.8}_{−0.8} 2.8^{+1.1}_{−1.1} kT_1 (keV) 0.83^{+0.02}_{−0.02} 0.25^{+0.02}_{−0.02} EM_1 (10^{52} cm^{−3}) 3.4^{+0.6}_{−0.6} 1.4^{+0.4}_{−0.4} kT_2 (keV) 3.9^{+2.4}_{−0.9} 0.94^{+0.03}_{−0.03} EM_2 (10^{52} cm^{−3}) 0.8^{+0.2}_{−0.2} 1.7^{+0.4}_{−0.4} kT_3 (keV) – 3.4^{+0.7}_{−0.6} EM_3 (10^{52} cm^{−3}) – 0.9^{+0.2}_{−0.1} Z (Z_⊙) 0.13^{+0.03}_{−0.02} 0.29^{+0.09}_{−0.05} L_{X,[0.3−10]} (10^{29} erg s^{−1}) 3.88^{+0.06}_{−0.06} 4.33^{+0.07}_{−0.07} χ^2(dof) 1.56 (120) 1.08 (118)

Notes. N_H, kT, and EM are the galactic Hi column density, plasma temperature, and emission measures, respectively. Z is global metallic abundances and L_{X,[0.3−10]} is the derived luminosity in the XRT band.

plasma temperatures were derived to be >14.4 keV and ∼11 keV for flares F1 and F2, whereas peak L_{x,[14−50]} were derived to be 1.2 ± 0.1 × 10^{32} and 1.1 ± 0.1 × 10^{31} erg s^{−1}.

6 Karmakar et al.

TABLE 2 X-Ray Spectral Parameters of CC Eri During the Flare F1 Derived from the XRT Time-resolved Spectra.

Parts Time Interval kT^3 EM^3 Z

Fe Kα L_{x,[0.3−10]} χ^2_ν (DOF) P E EW F_{Kα} (10^{−2} (s) (keV) (10^{54} cm^{−3} ) (Z_⊙) (keV) (keV) ph cm^{−2} s^{−1} ) (10^{31} erg s^{−1}) (%)

P3 T0_1 +137:T0_1 +197 11.6^{+1.0}_{−1.1} 6.9^{+0.3}_{−0.3} 1.9^{+0.3}_{−0.3} 6.37^{+0.06}_{−0.08} 132^{+64}_{−67} 1.2^{+0.6}_{−0.5} 17.3^{+0.2}_{−0.2} 1.179 (303) 89.3 P4 T0_1 +197:T0_1 +267 12.3^{+0.9}_{−0.9} 6.1^{+0.3}_{−0.3} 2.3^{+0.4}_{−0.4} 6.38^{+0.07}_{−0.07} 124^{+46}_{−66} 1.1^{+0.5}_{−0.5} 16.0^{+0.2}_{−0.2} 1.119 (312) 88.5 P5 T0_1 +267:T0_1 +347 8.3^{+0.5}_{−0.3} 5.0^{+0.2}_{−0.2} 2.1^{+0.3}_{−0.3} 6.21^{+0.05}_{−0.05} 173^{+90}_{−73} 0.9^{+0.4}_{−0.4} 13.0^{+0.1}_{−0.1} 0.951 (303) 93.9 P6 T0_1 +347:T0_1 +447 7.7^{+0.4}_{−0.4} 3.9^{+0.2}_{−0.2} 1.7^{+0.2}_{−0.2} 6.34^{+0.06}_{−0.05} 132^{+80}_{−77} 0.6^{+0.3}_{−0.3} 9.9^{+0.1}_{−0.1} 1.149 (292) 78.9 P7 T0_1 +447:T0_1 +587 6.5^{+0.2}_{−0.2} 2.9^{+0.1}_{−0.1} 1.5^{+0.2}_{−0.2} 6.41^{+0.06}_{−0.07} 77^{+92}_{−37} 0.4^{+0.2}_{−0.2} 6.85^{+0.07}_{−0.07} 1.238 (288) 80.3 P8 T0_1 +587:T0_1 +787 6.3^{+0.2}_{−0.2} 1.88^{+0.08}_{−0.08} 1.7^{+0.2}_{−0.2} 6.39 23^{+25}_{−23} <0.24 4.62^{+0.05}_{−0.05} 1.134 (282) 48.6 P9 T0_1 +787:T0_1 +1067 6.0^{+0.2}_{−0.2} 1.34^{+0.05}_{−0.05} 1.6^{+0.2}_{−0.2} 6.38^{+0.08}_{−0.10} 77^{+68}_{−48} 0.2^{+0.1}_{−0.1} 3.26^{+0.03}_{−0.03} 1.273 (276) 55.1 P10 T0_1 +1067:T0_1 +1457 5.8^{+0.3}_{−0.3} 0.90^{+0.04}_{−0.04} 1.5^{+0.2}_{−0.2} 6.40^{+0.05}_{−0.05} 118^{+131}_{−24} 0.22^{+0.08}_{−0.08} 2.18^{+0.02}_{−0.02} 1.179 (266) 96.4 P11 T0_1 +1457:T0_1 +1897 5.1^{+0.2}_{−0.3} 0.63^{+0.03}_{−0.03} 1.0^{+0.2}_{−0.2} 6.41 68^{+55}_{−52} 0.06^{+0.05}_{−0.05} 1.37^{+0.02}_{−0.02} 1.043 (220) 77.4

Notes. kT_3, EM_3, and Z are the “effective” plasma temperature, emission measures, and abundances during different time intervals of flare decay, respectively. E is the Gaussian peak around 6.4 keV, EW is the equivalent width, F_{Kα} is the Kα line flux, L_{X,[0.3−10]} is the derived luminosity in XRT band, and P is the F-test probability, which indicates how much of an addition of the Gaussian line at 6.4 keV is significant, i.e. the emission line is not a result of random fluctuation of the data points. All the errors shown in this table are in the 68% confidence interval.

3.3. XRT Spectral Analysis

Time-resolved spectral analysis was also performed for the XRT data of both flares. The WT mode data for flares F1 and F2 were divided into nine and six time bins, respectively, so that each time bin contains sufficient and a similar number of counts. The length of time bins is variable, ranging from 60–440 s for the flare F1 and 130– 261 s for the flare F2. The dotted vertical lines in the bottom panel of Fig. 1(a and b) show the time intervals for which the XRT spectra were accumulated. The first seven time segments of XRT data were common with BAT data for the flare F1.

3.3.1. Post-flare Phase of the Flaring Event F1

The coronal parameters of the PF phase were derived by the fitting single (1-T), two (2-T), and three (3-T) temperatures apec model. The global abundances (Z) and interstellar Hi column density (N_H) were left as free parameters. None of the plasma models (1-T, 2-T, or 3-T) with solar abundances (Z_⊙) were formally acceptable because large values of χ^2 were obtained. The 2-T plasma model with sub-solar abundances was found to have a significantly better fit than the 1-T model with reduced χ^2 (χ^2) of 1.56 for 120 degrees of freedom (dof). Adding one more plasma component improves the fit significantly with χ^2 = 1.08 for 118 dof. The F-test applied to the χ^2 resulting from the fits with apec 2-T and 3-T models showed that the 3-T model was more significant with an F-statistics of 27.7 with a null hypothesis probability of 1.4×10^{−10}. The addition of one more thermal component did not show any further improvement in the χ^2; therefore, we assume that the postflare coronae of CC Eri were well represented by three temperature plasma. Table 1 summarizes the best-fit values of the 2-T and 3-T plasma models of various parameters along with their χ^2 value. The first two temperatures in the 3-T model were derived as 0.25±0.02 and 0.94±0.03 keV. These two temperatures are consistent to that derived by Crespo-Chacón et al. (2007) and Pandey & Singh (2008) for quiescent coronae of CC Eri using XMM-Newton data. This indicates that the postflaring region has not yet returned to the quiescent level and has a third thermal component of 3.4^{+0.7}_{−0.6} keV. With the preliminary analysis of the same data, Evans et al.

(2008) also suspected that the post-flare region was not a quiescent state. The X-ray luminosity in the 0.3–10.0 keV band during the post-flare region was derived to be 4.33±0.07×10^{29} erg s^{−1}, which was ∼5 times higher than the previously determined quiescent state luminosity in the same energy band by Pandey & Singh (2008) using XMM-Newton.

3.3.2. The flaring event F1

A 3-T plasma model was found to be acceptable in each segment of flaring event F1. The first two temperatures, corresponding EMs, and N_H were found to be constant within a 1σ level. The average values of all the segments of the first two temperatures were 0.3 ± 0.1 and 1.1 ± 0.2 keV, respectively. These two temperatures were very similar to that of the first two temperatures of the PF phase. Therefore, for the further spectral fitting of flare-segments of the flare F1, we fixed the first two temperatures to the average values. The free parameters were temperature and corresponding normalization of the third component along with the abundances. The time evolution of derived spectral parameters of flare F1 is shown in Fig. 3(a) and are given in Table 2. The abundance, temperature, and corresponding EM were found to vary during the flare. The peak values of abundances were derived to be 2.3±0.4 Z_⊙, which was ∼8 times more than the post-flaring region and ∼13 times more than that of the quiescent value of CC Eri (Pandey & Singh, 2008). The derived peak flare temperature of 12.3 ± 0.9 keV was ∼3.6 times more than the third thermal component observed in the PF phase. The EM followed the flare light curve and peaked at a value of 6.9±0.3×10^{54} cm^{−3}, which was ∼766 times more than the minimum value observed at the post-flare region. The peak X-ray luminosity in 0.3–10 keV energy band during flare F1 was derived to be 10^{32.2} erg s^{−1}, which was ∼400 times more luminous than that of the post-flare regions, whereas ∼1922 times more luminous than that of the quiescent state of CC Eri derived by Pandey & Singh (2008). The amount of soft X-ray luminosity during the time segments when only BAT data were collected were estimated by extrapolating the 14–50 keV luminosity derived from the best-fit

CC Eridani 7

TABLE 3 Time-resolved Spectral Parameters of CC Eri During the Flare F2 Derived from the XRT Spectra.

Parts Time Interval kT^1 kT^2 EM^1 EM^2 Z

Fe Kα L_{x,[0.3−10]} χ^2_ν (DOF) P E EW F_{Kα} (10^{−2} (s) (keV) (keV) (10^{54} cm^{−3} ) (10^{54} cm^{−3}) (Z_⊙ ) (keV) (keV) ph cm^{−2} s^{−1} ) (10^{31} erg s^{−1} ) (%)

P1 T0_2 +397:T0_2 +527 1.63^{+0.05}_{−0.07} 8.7^{+1.8}_{−1.0} 1.0^{+0.3}_{−0.2} 2.4^{+0.1}_{−0.1} 0.54^{+0.13}_{−0.12} 6.46^{+0.05}_{−0.05} 181^{+108}_{−75} 0.50^{+0.20}_{−0.19} 5.91^{+0.06}_{−0.06} 1.298 (288) 92.2 P2 T0_2 +527:T0_2 +687 1.25^{+0.04}_{−0.06} 6.0^{+0.4}_{−0.4} 0.20^{+0.05}_{−0.04} 2.18^{+0.07}_{−0.07} 1.03^{+0.14}_{−0.13} 6.28^{+0.13}_{−0.11} 101^{+42}_{−83} 0.15^{+0.13}_{−0.12} 4.90^{+0.05}_{−0.05} 1.205 (289) 46.2 P3 T0_2 +687:T0_2 +867 1.05^{+0.02}_{−0.03} 4.9^{+0.2}_{−0.2} 0.13^{+0.02}_{−0.02} 1.94^{+0.06}_{−0.06} 0.98^{+0.12}_{−0.11} 6.35 47^{+56}_{−47} 0.08^{+0.11}_{−0.08} 4.09^{+0.04}_{−0.04} 1.164 (285) 91.6 P4 T0_2 +867:T0_2 +1096 1.02^{+0.03}_{−0.03} 4.9^{+0.2}_{−0.2} 0.09^{+0.01}_{−0.01} 1.50^{+0.05}_{−0.05} 1.06^{+0.12}_{−0.11} 6.19^{+0.06}_{−0.06} 244^{+76}_{−106} 0.22^{+0.09}_{−0.09} 3.23^{+0.03}_{−0.03} 0.968 (283) 96.7 P5 T0_2 +1096:T0_2 +1366 1.25^{+0.05}_{−0.07} 4.9^{+0.4}_{−0.3} 0.21^{+0.07}_{−0.05} 1.34^{+0.05}_{−0.05} 0.59^{+0.09}_{−0.19} 6.24 94^{+83}_{−80} 0.07^{+0.07}_{−0.07} 2.63^{+0.02}_{−0.03} 1.134 (277) 66.4 P6 T0_2 +1366:T0_2 +1627 1.04^{+0.02}_{−0.03} 4.2^{+0.2}_{−0.2} 0.08^{+0.01}_{−0.01} 1.11^{+0.04}_{−0.04} 0.97^{+0.12}_{−0.11} 6.25^{+0.13}_{−0.13} 162^{+112}_{−114} 0.09^{+0.06}_{−0.06} 2.25^{+0.02}_{−0.02} 0.925 (253) 65.2

Notes. Parameters have similar meanings as in Tables 1 and 2.

8 Karmakar et al.

TABLE 4 Time-resolved Spectral Parameters of the BAT and XRT+BAT Spectra of the Flares F1 and F2

Flare Parts Time Interval kT EM Z F^{7.11−50} (10^{−2} L^{x,[14−50]} χ^2_ν (DOF) (s) (keV) (10^{54} cm^{−3} ) (Z_⊙) ph cm^{−2} s^{−1} ) (10^{31} erg s^{−1})

F1

P1^∗ T0_1 –243 : T0_1 –43 > 14.4 2.0^{+1.1}_{−0.6} 1.64^† – 3.7^{+0.6}_{−0.6} 0.893 (15) P2^∗ T0_1 –43 : T0_1 +137 14^{+2}_{−1} 14.2^{+2.6}_{−2.3} 1.64^† – 11.7^{+1.0}_{−1.1} 0.581 (15)

P3 T0_1 +137 : T0_1 +197 15.0^{+0.7}_{−0.7} 6.9^{+0.3}_{−0.3} 2.3^{+0.4}_{−0.4} 37.3^{+0.4}_{−0.4} 7.02^{+0.07}_{−0.07} 1.193 (322) P4 T0_1 +197 : T0_1 +267 14.1^{+0.7}_{−1.1} 6.1^{+0.3}_{−0.3} 2.6^{+0.4}_{−0.4} 33.1^{+0.3}_{−0.3} 5.95^{+0.06}_{−0.06} 1.104 (331) P5 T0_1 +267 : T0_1 +347 9.80^{+0.4}_{−0.4} 4.8^{+0.2}_{−0.2} 2.4^{+0.3}_{−0.3} 20.3^{+0.2}_{−0.2} 2.67^{+0.03}_{−0.03} 0.978 (322) P6 T0_1 +347 : T0_1 +447 8.25^{+0.3}_{−0.3} 3.9^{+0.2}_{−0.2} 1.9^{+0.3}_{−0.2} 12.7^{+0.1}_{−0.1} 1.38^{+0.01}_{−0.01} 1.173 (311) P7 T0_1 +447 : T0_1 +587 7.39^{+0.4}_{−0.4} 2.8^{+0.1}_{−0.1} 1.7^{+0.2}_{−0.2} 7.88^{+0.08}_{−0.08} 0.752^{+0.008}_{−0.008} 1.256 (307) P8 T0_1 +587 : T0_1 +787 6.44^{+0.2}_{−0.2} 1.86^{+0.07}_{−0.07} 1.8^{+0.2}_{−0.2} 4.58^{+0.05}_{−0.05} 0.364^{+0.004}_{−0.004} 1.134 (300) P9 T0_1 +787 : T0_1 +957 6.08^{+0.2}_{−0.2} 1.33^{+0.05}_{−0.05} 1.7^{+0.2}_{−0.2} 2.94^{+0.03}_{−0.03} 0.217^{+0.002}_{−0.002} 1.247 (295)

F2^∗ – T0_2 –242 : T0_2 +938 11^{+3}_{−2} 1.2^{+0.9}_{−0.6} 1.00^† – 1.1^{+0.1}_{−0.1} 0.683 (15)

Notes. kT, EM, and Z are the “effective” plasma temperature, emission measures, and abundances during different time intervals of flare decay, respectively. F_{7.11−50} is the flux derived in the 7.11–50 keV energy band. L_{X,[14−50]} is the luminosity derived in the 14–50 keV energy band. All the errors shown in this table are in the 68% confidence interval.

* - In these time segments, only BAT spectra were available and best-fitted with the single temperature apec model, whereas in other segments, XRT+BAT spectra were fitted with three temperature apec with the first two temperatures fixed to the quiescent value. † - The abundances were kept fixed at the average abundance derived from XRT spectral fitting.

apec model of the BAT data using webpimms^4 and is shown by solid triangles in the top panels of Fig. 3(i).

3.3.3. The flaring event F2

For the flaring event F2, no pre-/post-flare or quiescent states were observed; therefore, a time-resolved spectroscopy was done by fitting 1-T, 2-T, and 3-T plasma models. A 2-T plasma model was found suitable for each flare segment as the minimum value of χ^2 was obtained. Initially, in the spectral fitting N_H was a free parameter and was constant within a 1σ level; therefore, in the next stage of spectral fitting, we fixed N_H to its average value. The derived spectral parameters are given in Table 3. Both the temperatures and the corresponding EM along with the global abundances were found to be variable during the flare. In order to compare the plasma properties of the flare represented by two-temperature components, the total emission measure and temperature were calculated as EM = (EM_1 + EM_2) and T = (EM_1.T_1 + EM_2.T_2)/EM. The time evolution of spectral parameters along with the X-ray luminosity in 0.3-10 keV energy band for the flare F2 is shown in Fig. 3(ii). The abundances were varied from 0.5 to 1.1 Z_⊙. The flare temperature (weighted sum) and total EM were peaked at 6.7 ± 1.0 keV and 3.3±0.3×10^{54} cm^{−3}, respectively. These values are two to three times higher than the respective minimum observed values. At the end of the flare, the X-ray luminosity was found to be 38% of its maximum value of 10^{31.8} erg s^{−1}.

3.3.4. The emission line at 6.4 keV

In the spectral fitting of XRT spectra with the 3-T apec model for F1 and the 2-T apec model for F2, a significant positive residuals redward of the prominent Fe K complex at ≈6.7 keV were detected. This excess emission occurs at the expected position of the 6.4 keV Fe fluorescent line, which is not included in the apec line list. To determine whether indeed such emission is present in the XRT spectrum, we have fitted again the spectra with an

4 https://heasarc.gsfc.nasa.gov/cgibin/Tools/w3pimms/w3pimms.pl

additional Gaussian line component along with the bestfit plasma model. Initially, keeping free the width of the Gaussian line (σ), it converges to a very large value than the actual line width. Therefore, in order to get a best fit, we fixed the σ in every value from 10–200 eV with an increment of 10 eV. In this analysis, we have used the σ corresponding to the minimum χ^2 value, ranging from 40–80 eV for a different time segment of the flare. The line centroid (E) and the normalization along with the temperature, abundances, and EM were left free to vary. The best-fit parameters are given in Table 2 and 3, for the flares F1 and F2, respectively. In each segment, the best-fit line energy agrees with the Fe fluorescent feature at E ∼ 6.4 keV (see the sixth column of Table 2 and eighth column of Table 3). We applied the F-test to the χ^2 resulting from the fits with and without an additional Gaussian line, which shows the significance of the Fe Kα feature with a probability of the line not being a result of random fluctuation (see the last column of Table 2 and 3). The derived Fe Kα line flux shows variability and follows the light curve and peaked at a value of 1.2^{+0.6}_{−0.5}×10^{−2} photons s^{−1}cm^{−2} for the flare F1 and 5.0^{+2.0}_{−1.9}×10^{−3} photons s^{−1}cm^{−2} for the flare F2, which is ∼20 and ∼7 times more than the minimum observed Fe Kα flux, respectively. The equivalent width (EW) was found to be in the range of 23–173 eV for the flare F1 and 47–244 eV for the flare F2.

3.4. XRT+BAT Spectral Analysis

Time-resolved spectroscopy for the flare F1 was also performed with the XRT+BAT data. Very poor statistics of the BAT spectra did not allow us a time-resolved spectral analysis of the XRT+BAT spectra for the flare F2. A similar approach, as applied for the XRT spectral fitting was also applied for the XRT+BAT spectral fitting. For the flare F1, we choose seven time bins (P3– P9) similar to the spectral fitting of only-XRT data as described in the previous section (see Fig. 1). Since galactic Hi column density was not found to be variable during only-XRT spectral analysis; therefore, we fixed N_H to its average value. The global abundances, temperature, and corresponding EMs of the third component were free pa-

CC Eridani 9

TABLE 5 Loop parameters derived for flares F1 and F2 Sl. 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Parameters τ_{r,14−150} (s) τ_{d,14−150} (s) τ_{d,0.3−10} (s) L_{X,max} (10^{31} erg s^{−1}) T_{max} (10^6 K) ζ L (10^{10} cm) p (10^5 dyn cm^{−2}) n_e (10^{12} cm^{−3}) V (10^{29} cm^3) B (kG) E_H (10^3 erg s^{−1} cm^{−3}) H (10^{32} erg s^{−1}) E_{X,tot} (10^{35} erg) B_0 (kG) N_{loops} θ(^∘)

Flare F1 150 ± 12 283 ± 13 539 ± 4 17.3 ± 0.2 365 ± 33 0.550 ± 0.047 1.2 ± 0.1 15 ± 5 15 ± 7 ∼0.31 ∼6.1 ∼6.6 ∼2.1 >1.4 >12 ∼1 ∼90

Flare F2 146 ± 34 592 ± 114 1014 ± 17 5.91 ± 0.06 170 ± 32 0.819 ± 0.179 2.2 ± 0.6 0.8 ± 0.7 1.7 ± 1.7 ∼11.5 ∼1.4 ∼0.13 ∼1.5 >1.7 >2 ∼3 – 1, 2: e-folding rise and decay times derived from the BAT light curve. 3: e-folding decay time derived from the XRT light curve. 4: luminosity at the flare peak in the XRT band. 5: the maximum temperature in the loop at the flare peak. 6: slope in the density-temperature diagram during the flare decay. 7: flaring loop length. 8: maximum loop pressure at the flare peak. 9: maximum electron density in the loop at the flare peak. 10: loop volume of the flaring region. 11: minimum magnetic field. 12: heating rate per unit volume at the flare peak. 13: total heating rate at the flare peak. 14: total radiated energy. 15: total magnetic field required to produce the flare. 16: the number of loops needed to fill the flare volume assuming loop aspect ratio of 0.1. 17: the astrocentric angle between observer and the flare location on the stellar disk. (See the text for a detailed description).

rameters in the spectral fitting. The derived parameters are given in Table 4 and the variations of the spectral parameters are shown in Fig. 3. The peak temperature derived in this spectral fitting was found to be 15.0±0.7 keV, which is higher than the highest temperature derived from XRT spectral analysis. The EM was found to have the similar values as those derived from XRT spectral fitting, whereas the peak abundance was found to be ∼1.1 times higher than to that derived from XRT data.

3.5. Hydrodynamic modeling of flare decay

Although stellar flares cannot be spatially resolved, it is possible to infer the physical size and structure of flares from the flare loop models. A timedependent one-dimensional hydrodynamic model developed by Reale et al. (1997) to analyze the stellar flares assumes that the energy release occurs inside closed magnetic coronal structures, which confine the flaring plasma. The heat pulse is assumed to be released at the beginning of the flare at the apex of the flaring loop, and the thermodynamic cooling time scales the length of the flaring loop. Since the flaring plasma is also subjected to further prolonged heating, which extends into the decay phase of the flare, the actual flare decay time determined from the flare light curve would be longer than usual thermodynamic cooling time. In the case of spatially resolved solar flares, Sylwester et al. (1993) showed that the slope (ζ) in the density-temperature plane of the flare decay path provides a diagnostics of sustained heating. Using hydrodynamic simulations of semi-circular flaring loops with constant cross-sections, and including the effect of the heating in the decay, Reale et al. (1997) derived an empirical formula of loop length as L = τ_d √ T_{max} 1.85 × 10^{−4}F (ζ)

F (ζ) ≥ 1 (1)

where L is the loop length in centimeters, T_{max} is the maximum temperature (K) of the loop apex, and F (ζ) is a non-dimensional factor that provides a quantitative diagnostic of the ratio between the observed decay time (τ_d) to the thermodynamic cooling time (τ_{th}). The actual functional form of the parameter F (ζ) depends on the bandpass and spectral response of the instruments. For Swift XRT observations, the F (ζ) was calibrated by Osten et al. (2010) as

τ_d τ_{th}

= F (ζ) =

1.81 ζ − 0.1 + 0.67 0.4 < ζ ≲ 1.9 (2)

This limits the applicability of this model, because it assumes a flare process as a sequence of quasi-static states for the loop, in which the heating time-scale (τ_H) is very long in order to mask the loop’s intrinsic decay (τ_H ≫ τ_{th}) in the lower end, and a freely decaying loop with no heating (τ_H = 0) on the upper end. For stellar observations, no density determination is normally available; therefore, we used the quantity √ EM as a proxy of the density assuming the geometry of the flaring loop during the decay. Fig. 4 shows the path log √ EM versus log T for flares F1 and F2. A linear fit to the data provided the value of ζ as 0.550 ± 0.047 for flare F1 and 0.819±0.179 for flare F2. This indicates the presence of sustained heating during the decay phase of both flares.

The relationship between T_{max} and observed peak temperature (T_{obs}) was also calibrated for Swift XRT by Osten et al. (2010) as T_{max} = 0.0261×T^{1.244}_{obs} , where both temperatures are in K. For flares F1 and F2, T_{max} was calculated to be 365±33 and 170±32 MK, respectively. The flaring loop length was derived as 1.2±0.1×10^{10} cm for flare F1 and 2.2±0.6×10^{10} cm for flare F2. Assuming a semi-circular geometry, the flaring loop height (L/π) was estimated to be 0.1 and 0.2 times the stellar radius (R_⋆) of the primary component of CC Eri of the flares F1 and F2. The loop parameters for both the flares are given in Table 5.

3.6. Energetics

The derived loop lengths are much smaller than the pressure scale height^5 of the flaring plasma of CC Eri. Therefore, we can assume that the flaring loop is not far from a steady-state condition. We applied the RTV scaling laws (Rosner et al., 1978) to determine the maximum pressure (p) in the loop at the flare peak and found it to be ∼1.5×10^6 and ∼8×10^4 dyne cm^{−2} for the flares F1 and F2, respectively. The plasma density (n_e), the flaring volume (V ), and the minimum magnetic field (B) to confine the flaring plasma were derived as

n_e = p 2kT_{max} cm^{−3}; V = EM n^2_e cm^3; B = √ 8πp G (3)

5 The pressure scale height is defined as h_p = 2kT_{max}/(μg), where μ is the average atomic weight and g is the surface gravity of the star. Considering both the stellar components, the derived values of h_p are ≥9.8×10^{11} cm for flare F1 and ≥4.6×10^{11} cm for flare F2.

10 Karmakar et al.

Fig. 4.— Evolution of flares F1 (left) and F2 (right) in log √ EM – log T plane. The continuous line shows the best-fit during the decay phase of the flares with a slope ζ shown in the top left corner of each plot.

Fig. 5.— Modeling of 6.4 keV line flux for the seven time intervals during the decay of flare F1. The solid horizontal lines show the observed Fe Kα line fluxes of different time segments marked in the bottom of the plot. The dashed curves with similar thickness correspond to the modeled Fe Kα line flux variation with the astrocentric angle for the same time intervals. Thicker the lines correspond to the later time spans. The dark shaded regions indicate the upper and lower 68% confidence intervals of the first and last time segments, respectively.

The estimated values of n_e, V , and B during the flares F1 and F2 were 1.5×10^{13} and 1.7×10^{12} cm^{−3}, 3.1×10^{28} and 1.2×10^{30} cm^3, and ∼6.1 and ∼1.4 kG, respectively. Using the RTV scaling laws, we have also estimated the heating rate per unit volume (E_H =^{dH}_{dV dt} ≃ 10^5 p^{7/6} L^{−5/6}) at the peak of the flare as ≃6.6×10^3 and ≃1.3×10^2 erg cm^{−3} s^{−1} for the flares F1 and F2, respectively. The total heating rates (^{dH}_{dt} ≃^{dH}_{dV dt} × V ) at the peak of the flares were derived to be ∼2.1×10^{32} and ∼1.5×10^{32} erg s^{−1} for the flares F1 and F2, which were, respectively, ∼1.2 and ∼2.5 times higher than the flare maximum luminosity. If we assume that the heating rate is constant throughout the rise and decay phases of the flare, the total energy radiated [E_{X,tot} >^{dH}_{dt} × (τ_r + τ_d)] during the flares was derived to be >1.4×10^{35} erg for flare F1 and >1.7×10^{35} erg for flare F2. These values were ∼40 s and ∼47 s of bolometric energy output of the primary and ∼221 s and ∼264 s of bolometric en-

CC Eridani 11

ergy output of the secondary for the flares F1 and F2, respectively.

3.7. Modeling of Fluorescent Fe Kα Emission

In the stellar context, the detected iron Kα line is generally attributed to a fluorescent process, where the fluorescing material is a neutral or low ionization state of photospheric iron (Fe I–Fe XII), which shines on the Xray continuum emission arising from a loop-top source. Thus the detection of this line constraints the height of the flaring loop. The process involves photoionization of an inner K-shell electron and the de-excitation of an electron from a higher level at this energy. Thus the total photon flux above the Fe Kα ionization threshold of 7.11 keV is one of the main contributors to the observed flux in the Fe Kα line. For the solar flares, Bai (1979b) derived a formula for the flux of Fe Kα photons received on the Earth, which was later extended to stellar context by Drake et al. (2008) and is given by

F_{Kα} = f(θ)Γ(T, h)F_{7.11} photons cm^{−2} s^{−1} (4)

where F_{7.11} is the total flux above 7.11 keV, f(θ) is a function that describes the angular dependence of the emitted flux on the astrocentric angle (defined as an angle subtended by the flare and the observer), and Γ is the fluorescent efficiency. We used the coefficients derived by Drake et al. (2008) to determine the functional dependence of f(θ) and Γ for different loop heights (see Tables 2 and 3 of Drake et al., 2008). We could only get enough statistics in both XRT and BAT spectra (required to estimate F_{7.11}) for the flare F1; therefore, we have done our analysis only for flare F1. The value of Γ was taken as 0.96 for a loop height of 0.1 R_⋆ and a temperature of 100 MK, which are closest to the derived loop length and maximum temperature of the flare F1. Because photospheric iron abundances of CC Eri are not known, a default value of abundances of 3.16×10^{−5} was used in the calculations (see Drake et al., 2008). Since the flare F1 was only detected up to 50 keV (see § 3.1), in our analysis, we considered the upper limit of energy to be 50 keV. The model flux of the photon density spectrum above 7.11 keV was calculated by using best-fit apec model parameters from the joint spectral fitting of XRT+BAT spectra in different time intervals for flare F1. Fig. 5 shows the modeled Fe Kα flux as a function of the astrocentric angle of a flare height of 0.1 R_⋆ for different time segments. The corresponding observed flux is also shown by continuous lines of the same thickness. The modeled and observed Fe Kα line flux was found to overlap at an astrocentric angle of ∼90^∘.

4. DISCUSSION AND CONCLUSIONS

4.1. Temporal and spectral properties

In this paper, we have presented a detailed study of two X-ray superflares observed on an active binary system CC Eri with the Swift satellite. These flares are remarkable in the large enhancement of peak luminosity in soft and hard X-ray energy bands. A total of eight flares have been detected in X-ray bands on CC Eri thus far. Out of the eight flares, two flares are the strongest flares in terms of energy released. The soft Xray luminosity increased up to ∼400 and >3 times more than to that of the minimum observed values for the flares F1 and F2, respectively. The former is much larger than any of the previously reported flares on CC Eri observed with MAXI GCS (∼5–6 times more than quiescent; Suwa et al., 2011), Chandra (∼11 times more than quiescent; Nordon & Behar, 2007), XMM-Newton (∼2 times more than quiescent; Crespo-Chacón et al., 2007; Pandey & Singh, 2008), ROSAT (∼2 times more than quiescent; Pan & Jordan, 1995), and other flares observed with EXOSAT (Pallavicini et al., 1988), Einstein IPC (Caillault et al., 1988), and HEAO1 (Tsikoudi, 1982). However, similar magnitude flares have been reported in other stars such as DG CVn (Fender et al., 2015; Osten et al., 2016), EV Lac (Favata et al., 2000; Osten et al., 2010), II Peg (Osten et al., 2007), UX Ari (Franciosini et al., 2001), AB Dor (Maggio et al., 2000), Algol (Favata & Schmitt, 1999), and EQ1839.6+8002 (Pan et al., 1997). Considering that the flare happened in the primary (K7.5 V), the peak X-ray luminosity of flare F1 and flare F2 were, respectively, found to be 48% and 16% of bolometric luminosity (L_{bol}); if the flare happened in the secondary (M3.5 V) star, the peak X-ray luminosity of flares F1 and F2 were 267% and 91% of L_{bol}, whereas the peak luminosity for flares F1 and F2 were found to be 41% and 14% of combined L_{bol}, respectively.

Both flares appear to be the shortest duration flares observed on CC Eri thus far. However, a weak flare with a similar duration was observed by the XMM-Newton satellite (Crespo-Chacón et al., 2007). The durations of all other previously observed flares on CC Eri were in the range of 9–13 ks. The durations of the superflares on CC Eri are also found to be smaller than other observed superflares, e.g. ∼3 ks for EV Lac (Osten et al., 2010), >10 ks for II Peg (Osten et al., 2007), ∼14 ks for AB Dor (Maggio et al., 2000), and ∼45 ks for Algol (Favata & Schmitt, 1999). The e-folding decay times of both X-ray flares are shorter in the hard spectral band than those in the softer band.

During the flares F1 and F2, the observed temperature reached a maximum value of ∼174 MK for flare F1 and ∼128 MK, respectively. These values of temperatures are quite high from previously observed maximum flare temperatures on CC Eri (Crespo-Chacón et al., 2007; Nordon & Behar, 2007; Pandey & Singh, 2008), but are of the similar order to those of other superflares detected on II Peg (≈300 MK; Osten et al., 2007), DG CVn (≈290 MK; Osten et al., 2016), EV Lac (≈150 MK and ≈142 MK; Favata et al., 2000; Osten et al., 2010), and AB Dor (≈114 MK; Maggio et al., 2000). The abundances during the flares F1 and F2 are found to enhance ∼9 and ∼2 times more than those of the minimum values observed. During other superflares, abundances were found to increase between two to three times more than that of the quiescent level (Favata & Schmitt, 1999; Favata et al., 2000; Maggio et al., 2000). However, in the case of the superflare observed with Swift in EV Lac, the abundances were found to remain constant throughout the flare. From Fig. 3, it is evident that the abundance peaks after the temperature and luminosity peaks, which is consistent with a current idea in the literature (see Reale, 2007). This could be due to the heating and evaporation of the chromospheric gas, which increases the metal abundances in the flaring loop. For both flares, the temperature was peaked before the EM did. A similar delay was also observed in many other solar and stel-

12 Karmakar et al.

lar flares (e.g. Sylwester et al., 1993; Favata & Schmitt, 1999; Favata et al., 2000; Pandey & Singh, 2008). The temperature increases due to beam driven plasma heating and later subsequent evaporation of the plasma into upper parts of the coronal loop that increases its density, and therefore EM (∼n^2_e). Later coronal plasma cools down by thermal conduction and then via radiative losses (e.g. Cargill & Klimchuk, 2004).

4.2. Coronal loop properties

The derived loop lengths for the flares F1 and F2 are larger than previously observed flares by Crespo-Chacón et al. (2007) on CC Eri. The loop lengths are also in between the loop lengths derived for other G–K dwarfs, dMe stars, and RS CVn type binaries (e.g. Favata & Micela, 2003; Pandey & Singh, 2008, 2012). Instead of ∼3 times larger peak luminosity in flare F1 than that of the flare F2, the derived loop length for flare F2 is two times larger than that of flare F1, which might be interpreted as a result of an ∼1.4 times more sustained heating rate in the decay phase of flare F1 than that of flare F2. The heating rate during flare F1 is also found to be ∼49% of the bolometric luminosity of the CC Eri system, whereas during flare F2 the heating rate is only ∼35% of the combined bolometric luminosity. The derived heating rate is also found to be more than the maximum X-ray luminosity for both flares. This result is compatible with X-ray radiation being one of the major energy loss terms during the flares.

Present analysis allows us to make some relevant estimation of the magnetic field strength that would be required to accumulate the emitted energy and to keep the plasma confined in a stable magnetic loop configuration. Under the assumptions that the energy release is indeed of magnetic origin, the total non-potential magnetic field B_0 involved in a flare energy release within an active region of the star can be obtained from the relation

E_{X,tot} =

(B^2_0 − B^2) 8π × V (5)

Assuming that the loop geometry does not change during the flare, B_0 is estimated to be >12 and >2 kG for the flares F1 and F2, respectively. Bopp & Evans (1973) also estimated a large magnetic field of 7 kG on CC Eri at photospheric level. We have used the loop volume in the derivation of B_0, but this may not imply that the magnetic field fills up the whole volume. Rather, our estimation of B_0 is based on the assumption that the energy is stored in the magnetic field configuration (e.g. a large group of spots) of the field strength of several kG with a volume comparable to one of the flaring loops.

4.3. Flare Location and Fe Kα emission feature

Given that CC Eri is an active binary system, we can consider three possible scenarios of the flare origin: (i) energy release occurs due to magnetic reconnection between magnetic fields bridging two stars (see Uchida & Sakurai, 1983; Graffagnino et al., 1995), (ii) flares occurred on K-type primary star, and (iii) flares occurred on M-type secondary star. The binary separation of the CC Eri system of 1.4 ×10^{11} cm (Amado et al., 2000; Crespo-Chacón et al., 2007) is more than an order of the height of flaring loops for both flares. Therefore, it is more likely that the flares are attached to a corona of any one of the components of CC Eri. It is also very difficult to identify the component of the binaries on which the flares occured.

One of the most interesting findings is the detection of Fe Kα emission line in the X-ray spectra of CC Eri during the flares, whose flux depends on the photospheric iron abundance, the height of the emitting source, and the astrocentric angle between the emitting source and observer(Bai, 1979a; Drake et al., 2008). Recently, the Fe Kα emission line was also detected in several other cool active stars during large flares, such as HR 9024 (Testa et al., 2008) and II Peg (Ercolano et al., 2008), and has been well described by the fluorescence hypothesis. In most of the cases, the flaring loop length derived in this method was found to be consistent with the loop length derived from the hydrodynamic method. Using the loop length derived from the hydrodynamic model, the astrocentric angle between the flare and observer has been estimated as ∼90^∘. This shows that the region being illuminated by the flare, and thus fluorescing the photospheric iron, is located near the stellar limb.

This work made use of data supplied by the UK Swift Science Data Centre at the University of Leicester. This research has made use of the XRT Data Analysis Software (XRTDAS) developed under the responsibility of the ASI Science Data Center (ASDC), Italy. We thank the anonymous referee for useful comments.

Facility: Swift (BAT, XRT).

REFERENCES

Amado, P. J., Doyle, J. G., Byrne, P. B., Cutispoto, G., Kilkenny, D., Mathioudakis, M., & Neff, J. E. 2000, A&A, 359, 159 Anders, E., & Grevesse, N. 1989, Geochim. Cosmochim. Acta, 53, 197 Arnaud, K. A. 1996, in Astronomical Society of the Pacific Conference Series, Vol. 101, Astronomical Data Analysis Software and Systems V, ed. G. H. Jacoby & J. Barnes, 17 Bai, T. 1979a, Sol. Phys., 64, 417 —. 1979b, Sol. Phys., 62, 113 Barthelmy, S. D., et al. 2005, Space Sci. Rev., 120, 143 —. 2012, GRB Coordinates Network, 12985 Bopp, B. W., & Evans, D. S. 1973, MNRAS, 164, 343 Burrows, D. N., et al. 2005, Space Sci. Rev., 120, 165 Busko, I. C., Quast, G. R., & Torres, C. A. O. 1977, A&A, 60, L27

Caillault, J.-P., Drake, S., & Florkowski, D. 1988, AJ, 95, 887 Cargill, P. J., & Klimchuk, J. A. 2004, ApJ, 605, 911 Crespo-Chacón, I., Micela, G., Reale, F., Caramazza, M., López-Santiago, J., & Pillitteri, I. 2007, A&A, 471, 929 Demircan, O., Eker, Z., Karataş, Y., & Bilir, S. 2006, MNRAS, 366, 1511 Dickey, J. M., & Lockman, F. J. 1990, ARA&A, 28, 215 Drake, J. J., Ercolano, B., & Swartz, D. A. 2008, ApJ, 678, 385 Ercolano, B., Drake, J. J., Reale, F., Testa, P., & Miller, J. M.

2008, ApJ, 688, 1315 Evans, D. S. 1959, MNRAS, 119, 526 Evans, P. A., et al. 2008, The Astronomer’s Telegram, 1787 Favata, F., & Micela, G. 2003, Space Sci. Rev., 108, 577

CC Eridani 13

Favata, F., Reale, F., Micela, G., Sciortino, S., Maggio, A., & Matsumoto, H. 2000, A&A, 353, 987 Favata, F., & Schmitt, J. H. M. M. 1999, A&A, 350, 900 Fender, R. P., Anderson, G. E., Osten, R., Staley, T., Rumsey, C., Grainge, K., & Saunders, R. D. E. 2015, MNRAS, 446, L66 Franciosini, E., Pallavicini, R., & Tagliaferri, G. 2001, A&A, 375, 196 Godet, O., et al. 2009, A&A, 494, 775 Graffagnino, V. G., Wonnacott, D., & Schaeidt, S. 1995, MNRAS, 275, 129 Maggio, A., Pallavicini, R., Reale, F., & Tagliaferri, G. 2000, A&A, 356, 627 Moretti, A., et al. 2005, in Society of Photo-Optical

Instrumentation Engineers (SPIE) Conference Series, Vol. 5898, UV, X-Ray, and Gamma-Ray Space Instrumentation for Astronomy XIV, ed. O. H. W. Siegmund, 360–368 Morrison, R., & McCammon, D. 1983, ApJ, 270, 119 Nordon, R., & Behar, E. 2007, A&A, 464, 309 Osten, R. A., Brown, A., Wood, B. E., & Brady, P. 2002, ApJS, 138, 99 Osten, R. A., Drake, S., Tueller, J., Cummings, J., Perri, M., Moretti, A., & Covino, S. 2007, ApJ, 654, 1052 Osten, R. A., et al. 2010, ApJ, 721, 785 —. 2016, ApJ, 832, 174 Pallavicini, R., Monsignori-Fossi, B. C., Landini, M., & Schmitt, J. H. M. M. 1988, A&A, 191, 109 Pan, H. C., & Jordan, C. 1995, MNRAS, 272, 11 Pan, H. C., Jordan, C., Makishima, K., Stern, R. A., Hayashida, K., & Inda-Koide, M. 1997, MNRAS, 285, 735

Pandey, J. C., & Singh, K. P. 2008, MNRAS, 387, 1627 —. 2012, MNRAS, 419, 1219 Parmar, A. N., Culhane, J. L., Rapley, C. G., Wolfson, C. J., Acton, L. W., Phillips, K. J. H., & Dennis, B. R. 1984, ApJ, 279, 866 Reale, F. 2007, A&A, 471, 271 Reale, F., Betta, R., Peres, G., Serio, S., & McTiernan, J. 1997, A&A, 325, 782 Rosner, R., Tucker, W. H., & Vaiana, G. S. 1978, ApJ, 220, 643 Schaefer, B. E., King, J. R., & Deliyannis, C. P. 2000, ApJ, 529, 1026 Shibayama, T., et al. 2013, ApJS, 209, 5 Slee, O. B., Budding, E., Carter, B. D., Mengel, M. W., Waite, I., & Donati, J.-F. 2004, PASA, 21, 72 Smith, R. K., Brickhouse, N. S., Liedahl, D. A., & Raymond, J. C. 2001, ApJ, 556, L91 Suwa, F., et al. 2011, The Astronomer’s Telegram, 3837 Sylwester, B., Sylwester, J., Serio, S., Reale, F., Bentley, R. D., & Fludra, A. 1993, A&A, 267, 586 Testa, P., Drake, J. J., Ercolano, B., Reale, F., Huenemoerder, D. P., Affer, L., Micela, G., & Garcia-Alvarez, D. 2008, ApJ, 675, L97 Tsikoudi, V. 1982, ApJ, 262, 263 Uchida, Y., & Sakurai, T. 1983, in Astrophysics and Space Science Library, Vol. 102, IAU Colloq. 71: Activity in Red-Dwarf Stars, ed. P. B. Byrne & M. Rodono, 629–632 Zarro, D. M., Dennis, B. R., & Slater, G. L. 1992, ApJ, 391, 865