arXiv:1705.04656v1 [astro-ph.SR] 12 May 2017

MNRAS 000, 1–12 (2016) Preprint 26 May 2017 Compiled using MNRAS L^ATEX style file v3.0

The Homogenous Study of Transiting Systems (HoSTS). II. The influence of the line list on stellar parameters

Amanda P. Doyle,^{1⋆} Barry Smalley,^2 Francesca Faedi,^1 Don Pollacco,^1 Yilen Gómez Maqueo Chew^3

1Department of Physics, University of Warwick, Gibbet Hill Road, Coventry CV4 7AL, UK 2Astrophysics Group, Keele University, Staffordshire ST5 5BG, UK 3Instituto de Astronomía, Universidad Nacional Autónoma de México, Ciudad Universitaria, 04510, Ciudad de México, México

Accepted XXX. Received YYY; in original form ZZZ

ABSTRACT The use of high resolution, high signal-to-noise stellar spectra is essential in order to determine the most accurate and precise stellar atmospheric parameters via spectroscopy. This is particularly important for determining the fundamental parameters of exoplanets, which directly depend on the stellar properties. However, different techniques can be implemented when analysing these spectra which will influence the results. These include performing an abundance analysis relative to the solar values in order to negate uncertainties in atomic data, and fixing the surface gravity (log g) to an external value such as those from asteroseismology. The choice of lines used will also influence the results. In this paper, we investigate differential analysis and fixing log g for a set of FGK stars that already have accurate fundamental parameters known from external methods. We find that a differential line list gives slightly more accurate parameters compared to a laboratory line list, however the laboratory line list still gives robust parameters. We also find that fixing the log g does not improve the spectroscopic parameters. We investigate the effects of line selection on the stellar parameters and find that the choice of lines used can have a significant effect on the parameters. In particular, removal of certain low excitation potential lines can change the T_{eff} by up to 50 K. For future HoSTS papers we will use the differential line list with a solar microturbulence value of 1 km s^{−1}, and we will not fix the log g to an external value.

Key words: stars: abundances, stars: fundamental parameters

1 INTRODUCTION

Our understanding of exoplanets is strongly tied to our understanding of their host stars. The mass and radius of a transiting exoplanet cannot be determined without first knowing the mass and radius of the star (Winn 2011). Direct determinations of stellar mass and radius are only possible for those in a binary system (Andersen 1991). For other stars, the mass and radius needs to be determined indirectly. This can be done via asteroseismology once the effective temperature (T_{eff} ) is known (Chaplin et al. 2011). The planet transit can yield the stellar density, which can be used to determine the stellar mass and radius once the T_{eff} and metallicity are known (Sozzetti et al. 2007). The distance to a star, which can be measured via parallax with Gaia, can also be used to determine the stellar radius, once T_{eff} and bolometric flux are known (Stassun et al. 2016).

⋆ E-mail: Amanda.Doyle@warwick.ac.uk

For stars without asteroseismic measurements, spectroscopy is used to determine the T_{eff} , surface gravity (log g), and metallicity ([Fe/H]). These parameters are then input into a calibration (e.g. Torres et al. (2010)) or used with a grid of stellar models (e.g. Girardi et al. (2000)) to find the stellar mass and radius.

For the spectroscopic analysis, some authors rely on differential analysis as opposed to the atomic data from the VALD database (e.g. Meléndez et al. (2009), Bruntt et al. (2010), Brugamyer et al. (2011), Sousa et al. (2014)). The disadvantage is that differential analysis can only be performed accurately for stars with similar parameters to the Sun. However, while it is clear that stars with properties that deviate vastly from solar should not be used in differential analysis, it is not clear what the cut-off in parameters should be for planet host stars, which are typically FGK dwarfs and subgiants, although planets have also been found around giant stars (e.g. Wittenmyer et al. (2017)). In this paper we analyse a set of 23 FGK stars and compare a line list us-

© 2016 The Authors

2 A.P. Doyle et al.

ing the laboratory data from VALD with a differential line list in order to investigate if the differential list is really the best one to use and if errors are more likely for stars with parameters furthest from solar.

Due to the uncertainties inerrant in the spectroscopic log g, fixing the log g to an external value such as those obtained from the planet transit or asteroseismology can improve the spectroscopic parameters for some methods which directly compare the observed spectrum with a synthetic spectrum. For example, Torres et al. (2012) found that fixing log g improved the parameters when using the software SME and SPC, but when they used an equivalent width (EW) based method with the software MOOG, they found the latter to be more accurate. Mortier et al. (2014) also found the EW-based method does not require log g to be fixed to an external value.

The Homogeneous Study of Transiting Systems (HoSTS) project aims to characterise planets and their host stars consistently, and to use a homogeneous, high quality set of stellar spectra. Four spectral analysis methods were compared in the pilot study of WASP-13 (Gómez Maqueo Chew et al. (2013); hereafter Paper I) using a high resolution (R = 72 000) HIRES spectrum. Each of the methods performed three different analyses: an unconstrained analysis to obtain T_{eff} , log g and [Fe/H], an analysis with the T_{eff} fixed to that determined from the Hα line from a long-slit IDS spectrum, and an analysis with log g fixed from the transit value. Paper I found that the results from the unconstrained analysis agreed well between all four methods and are consistent with the transit log g and the Hα T_{eff} , leading to the conclusion that the four different methods of spectral analysis have no systematic differences between them.

In this paper we investigate differential analysis and fixing the log g to an external value, in order to determine if there is any preferential method. We also determine the effect that line selection will have on the stellar parameters. We use the Fe-line method, where the EWs are measured for a number of Fe lines in order to determine the stellar parameters. We also obtain the log g from the pressure broadened Mg i b and Na i D lines.

The stars that we chose to analyse are a set of 23 bright, standard stars that were previously analysed by Bruntt et al. (2010) (hereafter B10). This selection of standard stars was chosen for this work as the parameters span the range of stars that can host exoplanets, i.e. FGK stars from dwarfs to giants. B10 determined non-spectroscopic parameters for these stars, which are a useful test of our spectroscopic parameters; the bolometric T_{eff} , photometric T_{eff} , the log g determined from a binary mass and interferometric angular diameter, and asteroseismic log g. The bolometric T_{eff} from Heiter et al. (2015) (hereafter H15) is also used.

All of the spectra that we used were taken from the ESO HARPS archive and the spectra all have S/N ∼100. While higher S/N could be achieved by coadding several spectra, a S/N of 100 is more representative of a typical planet host star.

In Section 2, we discuss the methods used for our analysis and the selection of the line lists. Section 3 details our results where the results between the VALD and differential line lists are compared. Section 4 discusses the results and we conclude in Section 5.

2 METHODS

2.1 Measuring spectral parameters

The spectroscopic parameters can be determined using a set of Fe lines and we use the same method as in Doyle et al. (2013). Once the equivalent widths (EWs) of the lines have been measured, the abundance is calculated for each line. The low excitation potential (EP) Fe i lines are sensitive to temperature, where as the temperature sensitivity is negligible for high EP lines. Thus requiring that there is no trend between EP and abundance will yield the T_{eff} of the star and this is known as the excitation balance T_{eff} . The error for the excitation balance T_{eff} is from the 1-σ variation in the slope of abundance against excitation potential. The same principle can be applied to Fe ii lines, but in this case it is the high EP lines that are sensitive to T_{eff} changes. However, there are usually an insufficient number of Fe ii lines present in solar-like stars to determine the T_{eff} .

The log g of the star can be determined via the ionisation balance, which occurs when the Fe i and Fe ii abundances agree. This is because the Fe ii abundance will increase with increasing log g, where as the Fe i abundance is insensitive to log g variations (Takeda et al. 2002). The error for the ionisation balance log g is determined by varying the T_{eff} by 1σ. It should also be noted that the number of Fe ii lines used is an important factor in determining the ionisation balance log g. An insufficient number of Fe ii lines will lower the log g, and likely explains the low log g found in Paper I for WASP-13 using the Schuler et al. (2011) line list, as this list has only 5 Fe ii lines.

The microturbulence (vmic) is a line broadening parameter required in 1D analyses that also affects abundance and thus the derived T_{eff} and log g. Microturbulence was introduced by Struve & Elvey (1934) so that the abundance calculated from strong lines would be the same as for weak lines. Therefore the vmic is determined by requiring that there is no slope between the abundance and EW.

The determination of parameters via the Fe lines is an iterative process. The excitation balance T_{eff} is first determined using an initial T_{eff} guess from the bolometric, photometric, or the B10 spectroscopic value. An initial guess of 1 km s^{−1} is used for the vmic. A T_{eff} value is determined when the slope of the excitation balance plot is zero. The log g is then adjusted so that the Fe i and Fe ii abundances agree, and the vmic is adjusted until there is no trend between abundance and EW. The Fe i lines used to determine the excitation balance T_{eff} have very little dependence on the log g so the log g will not change the excitation balance. However, T_{eff} is sensitive to vmic, which will change the slope so that excitation balance no longer occurs. A second iteration of T_{eff} is therefore performed using the new vmic value. The new T_{eff} will affect the log g, therefore the ionisation balance needs to be redetermined. Several iterations are performed until the slopes of both plots have been minimised and the ionisation balance is correct.

2.2 Software

uclsyn (University College London SYNthesis) is the software we used for spectral analysis (Smith 1992; Smalley et al. 2001). atlas 9 models without convec-

MNRAS 000, 1–12 (2016)

HoSTS II 3

tive overshooting were used (Castelli et al. 1997) and local thermodynamic equilibrium (LTE) is assumed. Spectral lines were measured manually by using equivalent widths. A global continuum fit was performed using iSpec (Blanco-Cuaresma et al. 2014), however the local continuum still needed to be adjusted on a line-by-line basis within uclsyn. The atomic data used to generate the synthetic spectra was obtained from Kurucz & Bell (1995), although lines can also be input manually using atomic data from other sources. The broadening parameters that are input are microturbulence, macroturbulence, rotational velocity, and instrumental broadening. The radiative damping constant, Van der Waals damping constant, and the Stark broadening factor are input via the line list. We used the solar abundances from Asplund et al. (2009).

2.3 Line list

2.3.1 Line selection

We selected spectral lines from the Kitt Peak Solar Atlas (Kurucz et al. 1984) by looking for unblended lines. It is important to have as many low EP lines as possible for the determination of T_{eff} via the excitation balance, however many of these lines are in “resolved blends”^1, which meant that they were initially ignored when selecting lines from the solar spectrum. All of the low EP lines listed in the NIST database (Fuhr & Wiese 2006) were then checked in the solar spectrum. Any that were still measurable despite being in a resolved blend were added to the line list. Any lines with EW greater than 0.12 Å were not included as these will skew the vmic. This is because the stronger lines are affected more by vmic and also because the stronger lines are more difficult to measure due to the extent of the wings.

A line selected in the Sun may not necessarily be measurable in other stars. Stars with higher metallicity will have more blended lines, as will cooler stars. However, as we checked each line manually in each star, it is not necessary to have different line lists for different T_{eff} and metallicity ranges for our method. The majority of the lines are measurable in all of our spectra.

2.3.2 Low metallicity

Two of the stars in this sample have low metallicity; 171 Pup has [Fe/H] = −0.76, and ν Ind has [Fe/H] = −1.46. It is still possible to get a solution for these stars, although most of the lines are very weak so are more prone to errors. Ideally a separate line list should be used for low metallicity stars so as not to use only very weak lines. Lines which are easily measurable and unblended in low metallicity stars are usually too strong or blended in solar-metallicity stars. However, as most planet host stars do not have such low metallicities, we deemed it beyond the scope of this work to also create a line list for the low metallicity stars.

1 A resolved blend is where two close-by spectral lines have blended wings, but the individual lines can still be measured.

2.3.3 Atomic data

The oscillator strength (log gf) will affect the derived abundance for a line, however these values are not always known to great accuracy, which can create large errors in abundance. In order to deal with this problem, some authors instead use differential log gf values, i.e. those that are normalised to the Sun. Here, we create three line lists; one using the laboratory values thus giving the absolute abundances, and two differential line lists that use two different solar vmic values.

For the laboratory line list, the atomic data were taken from the VALD III database (Ryabchikova et al. 2015) and only the laboratory values for log gf were used. VALD II data were used for the log gf values for Fe ii. This is because the Fe ii log gf values from VALD III result in Fe ii abundances that are too low in the Sun. This changes the ionisation balance log g, which in turn changes the vmic. As T_{eff} is dependent on vmic, the resulting T_{eff} for the Sun becomes 5701 ± 33 K. The log g and vmic are 4.48 ± 0.08 dex and 0.72 ± 0.03 km s^{−1} respectively. This T_{eff} is too low compared to the known solar value of 5777 K (Gray 2008), however when using the Fe ii log gf values from VALD II (Kupka et al. 1999) the solar parameters are now 5750 ± 31 K, 4.42 ± 0.06 dex, and 0.83 ± 0.02 km s^{−1} for T_{eff} , log g, and vmic respectively.

It is known that the VALD values can be poorly determined, resulting in a large (∼0.6 dex) dispersion even in the Sun (Sousa et al. 2014). In order to have a line list that uses the VALD atomic data and still be as accurate as possible, we imposed several criteria for line selection. If a selected line did not have laboratory data available, then it wasn’t used. All lines were also required to have an abundance that didn’t deviate more than 0.25 dex from the mean abundance in the Sun. When these lines were used across all of the sample stars, we found that there were still a number of lines that resulted in abundances that were consistently too low or too high in all stars compared to the mean abundance of each star. If there was an alternate laboratory log gf available in VALD that gave a better abundance, then this was used. If there were no alternate values available, then the lines were deleted from the list. Our log A(Fe) for the Sun is 7.56 ± 0.07^2 and the metallicity error is from the dispersion in the abundance values.

For the two differential line lists, the log gf was adjusted so that all of the lines give the Asplund et al. (2009) abundance of log A(Fe) = 7.5 in the Sun. In order to calculate the abundance of each line, the solar parameters (T_{eff} = 5777 K and log g = 4.44 dex) need to be input, along with the solar vmic. Two different lists were produced using two different assumptions of solar vmic; 1.0 and 0.85 km s^{−1}, as there is no standard value for the solar vmic. Throughout the paper, the two lists will be referred to as differential(1) and differential(0.85). The line list is given in the appendix and uses the differential log gf values with a solar vmic of 1 km s^{−1}.

2 Abundances can be given in the format of log(A) + 12, where log(A) is the number ratio of the element with respect to hydrogen, log (N_{el}/N_H ). The format [X/H] refers to the abundance of an element relative to the Sun, i.e. [Fe/H] = 0 for the Sun.

MNRAS 000, 1–12 (2016)

4 A.P. Doyle et al.

Figure 1. ΔT_{eff} = T_{eff} differential(0.85) − T_{eff} differential(1). The T_{eff} derived differentially with the solar v_{mic} of 0.85 km s^{−1} is hotter for stars > 6000 K compared to the differential T_{eff} derived with solar v_{mic} of 1 km s^{−1}.

3 RESULTS

The parameters from B10 and H15 are given in Table 1. The T_{eff} , log g, metallicity, and vmic results from this work are displayed in Tables 2, 3, 4, and 5 respectively.

3.1 Comparison between laboratory and differential line lists

In this section, we compare the results from the laboratory and differential line lists to each other, and also compare the results from each list to the external parameters, i.e. the bolometric T_{eff} , the photometric T_{eff} , the binary log g, and the asteroseismic log g.

3.1.1 Temperature

There is good agreement in T_{eff} between the laboratory and differential lists. There is a difference of 2 ± 35 K between the laboratory and differential(1) list, and a difference of 9 ± 16 K between the laboratory and differential(0.85) list.

The difference in T_{eff} between the two different differential lists is 11 ± 26 K. The T_{eff} derived with the solar vmic of 0.85 km s^{−1} has a slightly higher T_{eff} of 36 ± 17 K for stars hotter than 6000 K, as seen in Figure 1. The most noticeable difference is Procyon, where the T_{eff} is 67 K higher. The difference in T_{eff} is because T_{eff} is dependent on vmic, and the output vmic for each star is dependent on which solar value was used initially to calculate the differential log gf.

The bolometric T_{eff} is a “direct” temperature determination in that it is almost independent of stellar models. The temperature is found from the bolometric flux and the angular diameter. The comparison between our spectroscopic T_{eff} using the laboratory line list and the bolometric T_{eff} is shown in the top panel of Figure 2. The values from both B10 and H15 are shown. H15 compiled bolometric temperatures for their sample of 34 Gaia FGK benchmark stars. The fact that there are two different versions of the bolometric T_{eff} , which is a direct measurement and is supposed to represent the fundamental T_{eff} of the star, is a matter of

Figure 2. The top panel shows the comparison between the spectroscopic T_{eff} with the laboratory line list from this work and the bolometric T_{eff} of Bruntt et al. (2010) (red circles) and Heiter et al. (2015) (blue triangles). The bottom panel shows the comparison between the spectroscopic T_{eff} and the photometric T_{eff} from B10. Our temperatures are hotter for stars with T_{eff} > 6000 K.

concern. It is difficult to compare our indirect values with the fundamental T_{eff} when even those values are not certain.

Our T_{eff} using the laboratory list is hotter on average than B10 by 81 ± 86 K, and H15 by 32 ± 74 K. There is good agreement for the stars < 6000 K, particularly for the H15 values. For the three stars hotter than 6000 K, our spectroscopic T_{eff} values using the laboratory list are significantly hotter, bringing the difference to 180 ± 30 K for B10 and 113 ± 26 K for H15.

The differential(1) T_{eff} is hotter than B10 by 87 ± 76 K and H15 by 36 ± 67 K. The differential(0.85) T_{eff} is hotter than B10 by 91 ± 87 K and H15 by 41 ± 78 K. Therefore there is no advantage or disadvantage to using the laboratory line list for T_{eff} .

The comparison between our spectroscopic T_{eff} using the laboratory list and the photometric T_{eff} from B10, which is derived from Strömgren photometric indices, is shown in the middle panel of Figure 2. Our temperatures are systematically higher by 70 ± 80 K. The differential(1) T_{eff} is hotter than the photometric T_{eff} by 55 ± 80 K and the differential(0.85) T_{eff} is hotter by 76 ± 81, K suggesting that the differential(1) list offers a slight improvement with T_{eff} over the other two lists.

MNRAS 000, 1–12 (2016)

HoSTS II 5

Table 1. The bolometric and photometric T_{eff} , the binary and asteroseismic log g, and the [Fe/H] from Bruntt et al. (2010) are listed. The errors on the photometric T_{eff} are 90 K and the errors on the [Fe/H] are 0.07 dex. The bolometric T_{eff} values from Heiter et al. (2015) are also given.

Star name HD T_{eff bol} T_{eff bol} T_{eff phot} log g_{bin} log g_{ast} [Fe/H] B10 H15

171 Pup 63077 5790 4.244 ± 0.023 −0.86 70 Oph A 165341 4.468 ± 0.030 4.555 ± 0.023 0.12 α Cen A 128620 5746 ± 50 5792 ± 16 5635 4.307 ± 0.005 4.318 ± 0.017 0.22 α Cen B 128621 5140 ± 56 5231 ± 20 4.538 ± 0.008 4.530 ± 0.018 0.30 α For 20010 6105 4.003 ± 0.033 −0.28 α Men 43834 0.15 β Aql 188512 4986 ± 111 3.525 ± 0.036 −0.21 β Hyi 2151 5840 ± 59 5873 ± 45 5870 3.955 ± 0.018 −0.10 β Vir 102870 6012 ± 64 6083 ± 41 6150 4.125 ± 0.018 0.12 δ Eri 23249 4986 ± 57 4954 ± 30 3.827 ± 0.018 0.15 δ Pav 190248 5540 4.306 ± 0.034 0.38 η Boo 121370 6028 ± 47 6099 ± 28 6025 3.822 ± 0.019 0.24 η Ser 168723 3.029 ± 0.037 −0.11 γ Pav 203608 6135 4.397 ± 0.022 −0.74 γ Ser 142860 6245 4.169 ± 0.032 −0.26 HR 5803 139211 6280 4.229 ± 0.023 −0.04 ι Hor 17051 6110 4.399 ± 0.022 0.15 ξ Hya 100407 4984 ± 54 5044 ± 40 2.883 ± 0.032 0.21 μ Ara 160691 5690 4.228 ± 0.023 0.32 ν Ind 211998 3.432 ± 0.035 −1.63 Procyon A 61421 6494 ± 48 6554 ± 84 6595 3.976 ± 0.016 3.972 ± 0.018 0.01 τ Cet 10700 5383 ± 47 5414 ± 21 5420 4.533 ± 0.018 −0.48 τ PsA 210302 6385 4.240 ± 0.021 0.01

Table 2. The effective temperatures derived in this work. The second column gives the T_{eff} based on the abundances from the laboratory list. The third column gives the constrained T_{eff} after fixing the log g to the asteroseismic value. The fourth and fifth columns give the T_{eff} determined when using abundances calculated differentially to the Sun, with a solar v_{mic} of 1 and 0.85 km s^{−1} respectively.

Star name Laboratory Fixing log g Differential Differential v_{mic} 1 km s^{−1} v_{mic} 0.85 km s^{−1}

171 Pup 5747 ± 37 5771 ± 38 5760 ± 35 5783 ± 36 70 Oph A 5300 ± 43 5295 ± 55 5355 ± 23 5333 ± 23 α Cen A 5799 ± 38 5792 ± 37 5825 ± 21 5826 ± 21 α Cen B 5197 ± 52 5189 ± 82 5220 ± 31 5202 ± 31 α For 6281 ± 47 6275 ± 49 6253 ± 37 6289 ± 40 α Men 5606 ± 38 5614 ± 36 5627 ± 17 5620 ± 18 β Aql 5082 ± 41 5072 ± 50 5103 ± 24 5089 ± 26 β Hyi 5870 ± 37 5875 ± 36 5864 ± 25 5874 ± 26 β Vir 6224 ± 46 6231 ± 43 6209 ± 29 6232 ± 30 δ Eri 4976 ± 48 4960 ± 55 5023 ± 31 5005 ± 33 δ Pav 5576 ± 47 5560 ± 47 5611 ± 21 5599 ± 22 η Boo 6205 ± 83 6231 ± 107 6200 ± 60 6214 ± 61 η Ser 4888 ± 48 4880 ± 53 4911 ± 21 4894 ± 23 γ Pav 6157 ± 51 6167 ± 51 6085 ± 39 6131 ± 42 γ Ser 6350 ± 55 6368 ± 50 6321 ± 40 6363 ± 41 HR 5803 6385 ± 47 6416 ± 46 6363 ± 35 6395 ± 37 ι Hor 6215 ± 45 6205 ± 44 6218 ± 34 6236 ± 36 ξ Hya 5097 ± 45 5101 ± 51 5120 ± 29 5106 ± 29 μ Ara 5764 ± 39 5757 ± 34 5772 ± 22 5772 ± 29 ν Ind 5218 ± 36 5212 ± 37 5178 ± 31 5195 ± 33 Procyon A 6645 ± 46 6648 ± 42 6583 ± 38 6650 ± 38 τ Cet 5317 ± 41 5322 ± 42 5320 ± 22 5308 ± 23 τ PsA 6494 ± 71 6511 ± 88 6426 ± 44 6473 ± 45

MNRAS 000, 1–12 (2016)

6 A.P. Doyle et al.

Table 3. The log g determined in this work. The second column gives the value based on the ionisation balance using the laboratory line list. The third and fourth columns give the log g determined when using abundances calculated differentially to the Sun, with a solar v_{mic} of 1 and 0.85 km s^{−1} respectively. The last two columns give the log g calculated from the pressure broadened Mg i b and Na i D lines.

Star name Laboratory Differential Differential Mg i b Na i D v_{mic} 1 km s^{−1} v_{mic} 0.85 km s^{−1}

171 Pup 4.17 ± 0.06 4.19 ± 0.06 4.22 ± 0.06 3.83 ± 0.10 4.00 ± 0.12 70 Oph A 4.35 ± 0.10 4.46 ± 0.06 4.43 ± 0.06 4.28 ± 0.15 4.45 ± 0.12 α Cen A 4.25 ± 0.09 4.32 ± 0.04 4.32 ± 0.04 4.02 ± 0.20 4.25 ± 0.10 α Cen B 4.36 ± 0.12 4.40 ± 0.07 4.38 ± 0.07 4.07 ± 0.30 4.50 ± 0.15 α For 4.09 ± 0.09 4.03 ± 0.07 4.08 ± 0.07 4.10 ± 0.40 4.10 ± 0.10 α Men 4.40 ± 0.09 4.44 ± 0.04 4.44 ± 0.04 4.30 ± 0.10 4.45 ± 0.13 β Aql 3.44 ± 0.11 3.47 ± 0.07 3.45 ± 0.07 3.27 ± 0.10 3.40 ± 0.15 β Hyi 3.95 ± 0.08 3.95 ± 0.04 3.96 ± 0.04 3.75 ± 0.17 3.95 ± 0.10 β Vir 4.22 ± 0.08 4.17 ± 0.06 4.19 ± 0.06 4.07 ± 0.15 4.30 ± 0.20 δ Eri 3.49 ± 0.14 3.63 ± 0.08 3.60 ± 0.08 3.13 ± 0.05 3.45 ± 0.25 δ Pav 4.18 ± 0.11 4.23 ± 0.08 4.21 ± 0.08 3.85 ± 0.05 4.15 ± 0.15 η Boo 4.04 ± 0.19 4.04 ± 0.09 4.06 ± 0.09 3.93 ± 0.10 4.10 ± 0.20 η Ser 2.96 ± 0.15 3.02 ± 0.07 3.00 ± 0.07 2.48 ± 0.35 2.75 ± 0.15 γ Pav 4.31 ± 0.08 4.18 ± 0.08 4.24 ± 0.08 4.23 ± 0.20 4.10 ± 0.20 γ Ser 4.17 ± 0.09 4.18 ± 0.06 4.23 ± 0.06 4.13 ± 0.15 4.33 ± 0.05 HR 5803 4.21 ± 0.08 4.18 ± 0.06 4.22 ± 0.06 4.15 ± 0.10 4.10 ± 0.05 ι Hor 4.43 ± 0.08 4.43 ± 0.06 4.45 ± 0.06 4.25 ± 0.15 4.35 ± 0.05 ξ Hya 2.93 ± 0.14 2.94 ± 0.07 2.92 ± 0.07 2.27 ± 0.30 2.80 ± 0.40 μ Ara 4.20 ± 0.08 4.20 ± 0.05 4.21 ± 0.05 4.02 ± 0.20 4.20 ± 0.20 ν Ind 3.40 ± 0.10 3.26 ± 0.09 3.29 ± 0.09 2.92 ± 0.10 2.90 ± 0.10 Procyon A 3.96 ± 0.07 3.90 ± 0.05 3.93 ± 0.05 3.98 ± 0.05 4.00 ± 0.05 τ Cet 4.49 ± 0.10 4.47 ± 0.05 4.46 ± 0.05 4.20 ± 0.30 4.30 ± 0.10 τ PsA 4.31 ± 0.11 4.27 ± 0.07 4.32 ± 0.07 4.52 ± 0.25 4.35 ± 0.05

Table 4. The metallicity determined in this work. All abundances are relative to Asplund et al. (2009). The second column gives the [Fe/H] using the laboratory line list. The third and fourth columns give the [Fe/H] determined when using abundances calculated differentially to the Sun, with a solar v_{mic} of 1 and 0.85 km s^{−1} respectively. The fifth and sixth columns give the [Mg/H] and [Na/H] abundances respectively.

Star name Laboratory Differential Differential [Mg/H] [Na/H] v_{mic} 1 km s^{−1} v_{mic} 0.85 km s^{−1}

171 Pup −0.76 ± 0.09 −0.82 ± 0.08 −0.82 ± 0.08 −0.59 ± 0.07 −0.59 ± 0.08 70 Oph A 0.14 ± 0.09 0.08 ± 0.05 0.08 ± 0.05 0.21 ± 0.07 0.18 ± 0.07 α Cen A 0.31 ± 0.08 0.24 ± 0.05 0.25 ± 0.05 0.39 ± 0.10 0.44 ± 0.08 α Cen B 0.29 ± 0.10 0.21 ± 0.06 0.21 ± 0.07 0.51 ± 0.12 0.45 ± 0.09 α For −0.09 ± 0.08 −0.18 ± 0.07 −0.17 ± 0.07 −0.16 ± 0.21 −0.09 ± 0.05 α Men 0.21 ± 0.09 0.14 ± 0.05 0.14 ± 0.05 0.29 ± 0.05 0.28 ± 0.09 β Aql −0.09 ± 0.10 −0.14 ± 0.07 −0.15 ± 0.07 0.06 ± 0.07 −0.04 ± 0.08 β Hyi 0.01 ± 0.08 −0.08 ± 0.06 −0.08 ± 0.06 0.11 ± 0.07 0.06 ± 0.09 β Vir 0.27 ± 0.09 0.18 ± 0.06 0.19 ± 0.06 0.27 ± 0.09 0.29 ± 0.11 δ Eri 0.15 ± 0.11 0.09 ± 0.09 0.09 ± 0.09 0.38 ± 0.02 0.30 ± 0.13 δ Pav 0.43 ± 0.09 0.37 ± 0.06 0.37 ± 0.06 0.59 ± 0.02 0.59 ± 0.10 η Boo 0.40 ± 0.12 0.31 ± 0.09 0.31 ± 0.09 0.37 ± 0.04 0.60 ± 0.09 η Ser −0.11 ± 0.11 −0.17 ± 0.05 −0.18 ± 0.05 0.06 ± 0.14 −0.05 ± 0.09 γ Pav −0.58 ± 0.09 −0.69 ± 0.08 −0.69 ± 0.08 −0.50 ± 0.13 −0.38 ± 0.13 γ Ser −0.12 ± 0.09 −0.22 ± 0.06 −0.21 ± 0.06 −0.10 ± 0.06 −0.06 ± 0.01 HR 5803 0.10 ± 0.08 0.01 ± 0.06 0.02 ± 0.06 0.08 ± 0.08 0.09 ± 0.00 ι Hor 0.23 ± 0.09 0.15 ± 0.07 0.16 ± 0.07 0.28 ± 0.08 0.28 ± 0.05 ξ Hya 0.26 ± 0.09 0.18 ± 0.07 0.18 ± 0.07 0.43 ± 0.10 0.50 ± 0.15 μ Ara 0.38 ± 0.08 0.30 ± 0.05 0.30 ± 0.05 0.43 ± 0.09 0.51 ± 0.10 ν Ind −1.46 ± 0.10 −1.56 ± 0.09 −1.57 ± 0.09 −1.09 ± 0.05 −1.54 ± 0.05 Procyon A 0.04 ± 0.08 -0.06 ± 0.06 -0.04 ± 0.06 0.05 ± 0.07 0.10 ± 0.02 τ Cet −0.47 ± 0.10 −0.55 ± 0.09 -0.56 ± 0.10 −0.11 ± 0.07 −0.33 ± 0.06 τ PsA 0.18 ± 0.10 0.05 ± 0.06 0.06 ± 0.06 −0.03 ± 0.16 0.12 ± 0.03

MNRAS 000, 1–12 (2016)

HoSTS II 7

Table 5. The v_{mic} determined in this work. The errors are 0.03 km s^{−1}. The second column gives the v_{mic} based on the laboratory line list. The third and fourth columns give the v_{mic} when using abundances calculated differentially to the Sun, with a solar v_{mic} of 1 and 0.85 km s^{−1} respectively.

Star name Laboratory Differential Differential 1 km s^{−1} 0.85 km s^{−1}

171 Pup 0.81 1.15 1.02 70 Oph A 0.79 0.94 0.79 α Cen A 0.87 1.02 0.89 α Cen B 0.74 0.85 0.71 α For 1.19 1.37 1.28 α Men 0.74 0.96 0.80 β Aql 0.91 0.96 0.86 β Hyi 1.00 1.17 1.07 β Vir 1.12 1.29 1.18 δ Eri 0.86 0.94 0.85 δ Pav 0.80 0.94 0.80 η Boo 1.36 1.49 1.41 η Ser 1.02 1.09 1.01 γ Pav 1.00 1.29 1.19 γ Ser 1.34 1.54 1.45 HR 5803 1.17 1.34 1.25 ι Hor 0.96 1.14 1.02 ξ Hya 1.18 1.25 1.18 μ Ara 0.90 1.07 0.95 ν Ind 1.06 1.31 1.23 Procyon A 1.61 1.80 1.72 τ Cet 0.62 0.36 τ PsA 1.23 1.47 1.39

Figure 3. Δlog g = log g differential(0.85) − log g differential(1). The log g derived differentially with the solar v_{mic} of 0.85 km s^{−1} is higher for stars > 6000 K compared to the differential log g derived with solar v_{mic} of 1 km s^{−1}.

3.1.2 Surface gravity

There is good agreement between the laboratory and differential line lists for log g. There is a difference of 0.00 ± 0.07 dex between laboratory and differential(1) and 0.01 ± 0.05 dex between laboratory and differential(0.85). The difference between the two differential lists is 0.01 ± 0.03 dex, however this depends on T_{eff} as seen in Figure 3.

Only four stars in this sample have log g known from their binary nature. There is excellent agreement between

Figure 4. The difference between spectroscopic and asteroseismic log g as a function of T_{eff} . The dotted line at 0.08 dex is the mean difference between log g_{spec} and log g_{ast} found by Bruntt et al. (2012). The blue line is the linear trend seen in Mortier et al. (2014). There appears to be a T_{eff} dependence in our data, but if the two outliers (δ Eri and η Boo) are removed then this no longer holds.

the binary log g for Procyon (3.976 ± 0.016 dex) our spectroscopic log g using the laboratory list (3.96 ± 0.07 dex). The differential(1) and differential(0.85) lists give slightly lower log g values, 3.90 ± 0.05 and 3.93 ± 0.05 dex respectively.

The binary log g for α Cen A is 4.307 ± 0.005 dex, which agrees with the spectroscopic log g with the laboratory list of 4.25 ± 0.09 dex within the errors. The differential(1) and differential(0.85) values, which are both 4.32 ± 0.04 dex, are in much better agreement with the fundamental log g. The same is true for 70 Oph A, where the spectroscopic log g with the laboratory list (4.35 ± 0.10 dex) agrees with the binary log g (4.468 ± 0.030) within the errors, but the differential(1) and differential(0.85) values of 4.46 ± 0.06 and 4.43 ± 0.06 dex respectively are in better agreement with the fundamental value.

The spectroscopic log g with the laboratory list of 4.36 ± 0.12 dex does not agree with the binary log g for α Cen B, which is 4.538 ± 0.008 dex. The differential(1) and differential (0.85) values of 4.40 ± 0.07 and 4.38 ± 0.07 dex respectively agree within the errors.

When comparing the spectroscopic log g with the laboratory list to the asteroseismic log g, there is a lot of dispersion as seen in Figure 4. This figure shows the difference between the spectroscopic log g that we derived and the asteroseismic log g as a function of the spectroscopic T_{eff} with the laboratory list. Bruntt et al. (2012) found the mean difference between log g_{spec} and log g_{ast} to be 0.08 ± 0.07 dex for their sample of 93 solar-like Kepler stars, shown as a dashed line. In an analysis of 76 planet host stars by Mortier et al. (2014), the difference was found to be dependent on T_{eff} , and this is shown with the blue line.

The mean difference between the spectroscopic log g with the laboratory list and the asteroseismic log g is 0.04 ± 0.11 dex. There is no real improvement when using the differential lists, with the differential(1) list giving a mean difference of 0.04 ± 0.10 dex when compared to the astero-

MNRAS 000, 1–12 (2016)

8 A.P. Doyle et al.

Figure 5. The comparison between the laboratory [Fe/H] and the differential [Fe/H] (assuming a solar v_{mic} of 1 km s^{−1}). Δ[Fe/H] = laboratory − differential. The laboratory values are systematically higher.

seismic log g, and the differential(0.85) list giving a difference of 0.03 ± 0.10 dex.

3.1.3 Metallicity

The difference between [Fe/H] of the two differential analyses for our sample of stars is negligible; 0.00 ± 0.01 dex, showing that the choice of initial vmic does not affect the resulting abundance.

Our laboratory [Fe/H] is also systematically higher than both differential lists by 0.08 ± 0.02 dex, as seen in Figure 5.

The laboratory [Fe/H] is also systematically higher than the B10 [Fe/H] by 0.09 ± 0.06 dex. Both differential lists are in good agreement with the B10 values (0.01 ± 0.05 dex for differential(1) and 0.01 ± 0.06 dex for differential(0.85)), which is to be expected as the B10 line list was also created differentially to the Sun.

3.1.4 Microturbulence

Unlike T_{eff} and log g which are physical parameters, the vmic of the Sun is model-dependent and is also strongly dependent on the line list used. While either solar vmic can be used when creating a differential line list, it is important to remember that using log gf values calculated from the Sun will create a significant bias when trying to determine the vmic for another star. This is seen in Table 5, where the differential(0.85) line list always results in a lower vmic for other stars compared to the differential(1) list, as expected. The systematic offset is 0.11 ± 0.04 km s^{−1}.

3.2 Surface gravity from pressure broadened lines

We also obtained the log g for the pressure broadened Mg i b and Na i D lines, which are listed in Table 3. It is important to know the abundance of these elements before measuring the log g, so the EWs of several weaker Mg i and Na i lines were measured in order to determine the abundance. These are given in Table 4. The error for the pressure broadened log g is determined from the error in the Na and Mg abundances.

The continuum is very difficult to measure around the Mg triplet, particularly for cooler stars with high metallicity. As such, the log g from the Na i D lines should be prioritised, although it should be noted that these lines can be affected by interstellar absorption. The Ca lines used in B10 were not used here as these lines are much more sensitive to changes in other broadening factors such as macroturbulence and rotational velocity compared to the Mg i b and Na i D lines.

The log g from the Mg triplet is significantly underestimated compared to the binary log g, except for Procyon. The log g from the Na i D lines on the other hand, agrees well with all of the binary log g values.

The Mg log g does not compare well with the asteroseismic log g, giving a mean difference of 0.24 ± 0.25 dex. The Na log g is somewhat better, with a mean difference of 0.09 ± 0.19 dex compared to the asteroseismic log g.

There is no advantage to using the Mg triplet in order to get the spectroscopic log g, as the values are highly discrepant from the binary and asteroseismic log g. The Na i D returns reasonable results and can be used as an additional check of the spectroscopic log g, but it does not offer any improvement over the log g from the ionisation balance.

3.3 Mass and radius

The mass and radius were determined using the (Torres et al. 2010) calibration, which determines M and R from the T_{eff} , log g, and [Fe/H]. Two determinations of mass and radius are given in Table 6. The first uses the spectroscopic parameters determined using the differential(1) list. The second uses the asteroseismic log g, but the same values of T_{eff} and [Fe/H] as in the first determination. There is an improvement in the precision for the radius.

3.4 Line selection

The T_{eff} derived from the excitation balance, and thus the log g and [Fe/H], is sensitive to the exact lines used. α Cen B was used a test case and 1000 temperature runs were performed with 5 random Fe i lines removed for each run. The input parameters were those derived using the full set of lines with laboratory data; T_{eff} = 5197 K, log g = 4.34 dex and vmic = 0.74 km s^{−1}. The resulting T_{eff} distribution is shown in the top panel of Figure 6. The peak of the distribution is at 5198 ± 14 K. The middle panel shows the distribution with 10 Fe i lines removed, which has a peak at 5200 ± 20 K. The bottom panel has 30 Fe i lines removed with a peak at 5199 ± 42 K. With more lines removed, the scatter obviously increases and the result is that fewer runs return the input T_{eff} . In low S/N (∼50) CORALIE or SOPHIE spectra that are frequently used to characterise planet host stars, it is quite common for ∼30 lines to be unmeasurable when using the Doyle et al. (2013) line list of 72 Fe lines.

The lowest temperatures (5150 – 5185 K) in the plot with 5 Fe i lines removed are caused by the removal of two low EP lines; 6120 and 6625 Å. The top panel of Figure 7 shows the correct excitation balance for a T_{eff} of 5197 K using all of the Fe i lines. The middle panel of Figure 7 shows the excitation balance for the same T_{eff} , using the

MNRAS 000, 1–12 (2016)

HoSTS II 9

Table 6. The mass and radius are given in units of M⊙ and R⊙. M_{spec} and R_{spec} are the values determined using spectroscopy with the differential(1) list. M_{ast} and R_{ast} use the asteroseismic log g, but the same spectroscopic T_{eff} and [Fe/H].

Star name M_{spec} R_{spec} M_{ast} R_{ast} differential(1) differential(1)

171 Pup 0.93 ± 0.06 1.29 ± 0.11 0.91 ± 0.06 1.20 ± 0.05 70 Oph A 0.95 ± 0.06 0.94 ± 0.08 0.93 ± 0.06 0.84 ± 0.04 α Cen A 1.16 ± 0.07 1.22 ± 0.07 1.16 ± 0.07 1.22 ± 0.05 α Cen B 0.95 ± 0.06 1.00 ± 0.09 0.93 ± 0.06 0.85 ± 0.03 α For 1.30 ± 0.09 1.82 ± 0.19 1.31 ± 0.09 1.89 ± 0.11 α Men 1.04 ± 0.07 1.01 ± 0.06 β Aql 1.31 ± 0.10 3.50 ± 0.39 1.27 ± 0.09 3.23 ± 0.20 β Hyi 1.25 ± 0.08 1.96 ± 0.13 1.25 ± 0.08 1.94 ± 0.08 β Vir 1.32 ± 0.09 1.55 ± 0.13 1.34 ± 0.08 1.64 ± 0.07 δ Eri 1.22 ± 0.10 2.78 ± 0.34 1.10 ± 0.08 2.09 ± 0.09 δ Pav 1.16 ± 0.08 1.34 ± 0.15 1.14 ± 0.08 1.22 ± 0.07 η Boo 1.43 ± 0.11 1.87 ± 0.24 1.59 ± 0.09 2.54 ± 0.11 η Ser 1.67 ± 0.14 6.70 ± 0.75 1.66 ± 0.12 6.61 ± 0.43 γ Pav 1.04 ± 0.07 1.38 ± 0.16 0.98 ± 0.07 1.04 ± 0.05 γ Ser 1.23 ± 0.08 1.49 ± 0.13 1.23 ± 0.08 1.51 ± 0.08 HR 5803 1.31 ± 0.09 1.53 ± 0.13 1.29 ± 0.08 1.43 ± 0.06 ι Hor 1.21 ± 0.08 1.10 ± 0.09 1.22 ± 0.08 1.15 ± 0.05 ξ Hya 2.06 ± 0.17 8.11 ± 0.91 2.15 ± 0.14 8.85 ± 0.52 μ Ara 1.21 ± 0.08 1.42 ± 0.11 1.20 ± 0.08 1.37 ± 0.06 ν Ind 1.11 ± 0.10 4.25 ± 0.60 0.99 ± 0.08 3.28 ± 0.20 Procyon 1.53 ± 0.10 2.30 ± 0.18 1.47 ± 0.10 2.07 ± 0.09 τ Cet 0.81 ± 0.05 0.87 ± 0.06 0.80 ± 0.05 0.80 ± 0.03 τ PsA 1.30 ± 0.09 1.37 ± 0.13 1.31 ± 0.08 1.43 ± 0.06

set of lines that give a lower T_{eff} of 5150 K. The hottest temperatures (5220 – 5249 K) are caused by one low EP line (5250 Å) being removed, as seen in the lower panel of Figure 7 for a T_{eff} of 5249 K. This shows the importance of including as many low EP lines as possible.

For cool stars, it is extremely difficult to determine the position of the continuum for wavelengths less than ∼5200 Å due to the increased strength of the lines, as well as the addition of molecular lines. However, not including the lines less than ∼5200 Å only makes the solution worse. This is due to the removal of several low EP Fe i lines, as well as some Fe ii lines. The removal of Fe ii lines, even ones that are difficult to measure, will affect the ionisation balance log g. In the Sun, removing the lines below 5200 Å results in log g = 4.36 dex.

4 DISCUSSION

4.1 Differential analysis

When comparing the laboratory line list with the differential line lists, there is good agreement for T_{eff} and log g, however the [Fe/H] of the laboratory line list is systematically higher. In this regard, there is no clear advantage to using the differential lists, especially as it is not possible to tell which metallicity is the “correct” value.

When comparing the differential line lists to each other, there is excellent agreement in metallicity between the two lists. However, there is a difference in T_{eff} and log g as a function of increasing T_{eff} , most likely due to the different vmic. As these lists use different solar vmic values, the vmic determined for the stellar sample will also be different and vmic will affect the T_{eff} and log g.

There is no advantage or disadvantage to using either the laboratory or differential lists when comparing to the bolometric T_{eff} or asteroseismic log g, as the mean difference between the spectral parameters and the external parameters is the same for all lists. However, the mean difference between the differential(1) list and the photometric T_{eff} is lower than for the laboratory and differential(0.85) lists. There is excellent agreement between the log g with the laboratory list and the binary log g of Procyon, but for the other three binary stars, the differential lists are in better agreement.

Using either of the differential lists does not appear to have a negative effect on the parameters for stars with low metallicity or low log g, which suggests that differential analysis could be used on a wider range of stellar parameters than originally thought, although it would be better to test this with a larger sample.

While the line list using the laboratory log gf values from VALD does result in robust stellar parameters, for future HoSTS papers we will use the differential(1) list as it does seem to produce slightly more accurate results when comparing to the binary log g and the photometric T_{eff} .

4.2 Fixing log g

As shown in Figure 4, our spectroscopic log g with the laboratory list does not always agree with the asteroseismic log g. However, the offset between the values does not agree with that found by either Bruntt et al. (2012) or Mortier et al. (2014), showing that while there can be systematic offsets

MNRAS 000, 1–12 (2016)

10 A.P. Doyle et al.

Figure 6. The T_{eff} distribution for 1000 temperature runs of α Cen B with random Fe i lines removed. The top panel has 5 Fe i lines removed, the middle panel has 10 Fe i lines removed, and the bottom panel has 30 Fe i lines removed. The majority of runs still return the input value of 5197 K, but the scatter obviously increases when more lines are removed.

between the log g_{spec} and log g_{ast}, this depends on the specific method used for the analysis. Our results show that there might be some dependency with T_{eff} , as hotter stars tend to have log g_{spec} higher than log g_{ast}, where as cooler stars have a lower log g_{spec}. However, the trend is not as obvious as in Figure 6 of Mortier et al. (2014). The mean difference between log g_{spec} and log g_{ast} for our data is 0.04

Figure 7. The top panel shows the correct excitation balance at T_{eff} = 5197 K for α Cen B using using all of the Fe i lines. The middle panel shows one of the runs with 5 of the Fe i lines removed. The T_{eff} derived with this set of lines is 5150 K, however the plot is shown for the correct T_{eff} of 5197 K, thus introducing a slope. The bottom panel is for a derived T_{eff} = 5249 K, where the 5250 Å line is missing.

± 0.11 dex. If the two outliers, δ Eri and η Boo are removed, this difference reduces to 0.03 ± 0.08 dex.

When fixing the log g to the asteroseismic value and redetermining the T_{eff} , we found that the mean difference between the laboratory constrained and unconstrained T_{eff} is 3 ± 13 K, showing that there is excellent agreement between the unconstrained laboratory spectroscopic T_{eff} and

MNRAS 000, 1–12 (2016)

HoSTS II 11

the spectroscopic T_{eff} using the laboratory list obtained when log g is fixed to the asteroseismic value. This is because acquiring the T_{eff} via the excitation balance has little or no dependence on the log g. The excitation balance depends on the EP and the abundance of the Fe i lines, and these lines are not sensitive to changes in surface gravity. Changing the log g will therefore have a minimal effect on the T_{eff} derived from this method.

In contrast, Mortier et al. (2014) find a mean difference of 68 K for their sample, however they also take into account the vmic when determining their temperatures. For this method, after the excitation T_{eff} is determined with the log g fixed, the vmic is adjusted from the Fe i lines only (as the ionisation balance will no longer be met when including the Fe ii lines). Another iteration is run of the excitation balance T_{eff} with the new vmic. When we computed the laboratory constrained T_{eff} using this method, there is a mean difference of 18 ± 39 K between this and our unconstrained T_{eff} , which is still not as large as that of Mortier et al. (2014).

While fixing log g to the asteroseismic value does not have a significant effect on the spectroscopic parameters determined with this method, it may still be better to use the asteroseismic or transit log g, if available, when determining the mass and radius of the star as this will result in a more accurate mass and radius for the planet.

5 CONCLUSIONS

In this paper we have used a set of standard stars with known parameters to compare laboratory with differential line lists and also to test if the log g needs to be fixed to an external value. We have shown that the laboratory log gf values from VALD can be used to obtain robust parameters, although there may be a slight advantage to using the differential(1) line list. Despite the fact that we have subgiants and low metallicity stars in our sample, the differential lists still result in robust parameters, showing that it is possible to use the differential line lists across a range of stellar parameters that deviate somewhat from the solar values.

The choice of solar vmic when creating a differential line list will create a systematic offset in vmic for the stars analysed. This should be borne in mind when comparing vmic to that derived via different methods, but it is not a problem when a homogeneous analysis is performed using only one value. The different vmic will also cause differences in T_{eff} and log g as a function of increasing T_{eff} . Using the differential(0.85) list will give higher values of T_{eff} and log g for hotter stars compared to the differential(1) list.

The T_{eff} is sensitive to the selection of Fe i lines. Randomly removing Fe i lines decreases the chances of returning the correct T_{eff} in 1000 temperature iterations. The T_{eff} distribution for α Cen A with 5 Fe i lines removed is 5198 ± 14 K, for 10 Fe i lines removed the T_{eff} distribution is 5200 ± 20 K, and for 30 Fe i lines removed the T_{eff} distribution is 5199 ± 42 K. The T_{eff} is particularly sensitive to the number of low EP lines used and removing certain low EP lines can change the T_{eff} by ∼50 K. Therefore it is important to use as many low EP lines as possible.

We have also shown that fixing the log g to the transit or asteroseismology value offers no improvement to the spectroscopic T_{eff} and [Fe/H] for the EW method of spectral analysis. It is therefore sufficient to use the unconstrained values so that the spectral analysis will be self-consistent. However, fixing the log g to an external value does improve the stellar parameters in other methods which rely on comparing the observed spectrum directly to the synthetic spectrum (Torres et al. 2012). Also, the transit or asteroseismic log g should be used when determining the stellar mass and radius, as this will improve the precision on the planetary mass and radius.

The inclusion of the log g from the pressure broadened Mg i b and Na i D lines does not improve the result, and the Mg i b log g is usually worse. The Na i D lines can still be used as a check, but this log g is not better than the ionisation balance method.

While we have chosen to use the differential(1) list and not to fix log g in future HoSTS papers, we conclude that the most important factor is to have a consistent analysis across all stars. Future analyses may also avail of the improved stellar radii, and thus planetary radii, determined from the Gaia parallaxes, which will have improved precision after the second data release (Stassun et al. 2016).

ACKNOWLEDGEMENTS

We would like to thank Annelies Mortier and Dimitri Veras for helpful discussions. A.P.D. acknowledges support from the Leverhulme grant RPG-2014-082. This work has been partially funded by the Programa UNAM-DGAPA-PAPIIT IA-103215. Based on data obtained from the ESO Science Archive Facility.

REFERENCES

Andersen J., 1991, Astron. Astrophys. Rev., 3, 91 Asplund M., Grevesse N., Sauval A. J., Scott P., 2009, ARA&A, 47, 481 Batalha N. M., et al., 2011, ApJ, 729, 27 Blanco-Cuaresma S., Soubiran C., Heiter U., Jofré P., 2014, A&A, 569, A111 Brewer J. M., Fischer D. A., Basu S., Valenti J. A., Piskunov N., 2015, ApJ, 805, 126 Brugamyer E., Dodson-Robinson S. E., Cochran W. D., Sneden C., 2011, APJ, 738, 97 Bruntt H., et al., 2010, MNRAS, 405, 1907 Bruntt H., et al., 2012, MNRAS, 423, 122 Castelli F., Gratton R. G., Kurucz R. L., 1997, A&A, 318, 841 Chaplin W. J., et al., 2011, Science, 332, 213 Doyle A. P., et al., 2013, MNRAS, 428, 3164 Fuhr J. R., Wiese W. L., 2006, Journal of Physical and Chemical Reference Data, 35, 1669 Girardi L., Bressan A., Bertelli G., Chiosi C., 2000, A&AS, 141, 371 Gómez Maqueo Chew Y., et al., 2013, ApJ, 768, 79 Gray D., 2008, The Observation and Analysis of Stellar Photospheres, 3rd edn. Cambridge University Press, Cambridge, UK Heiter U., Jofré P., Gustafsson B., Korn A. J., Soubiran C., Thévenin F., 2015, A&A, 582, A49 Kupka F., Piskunov N., Ryabchikova T. A., Stempels H. C., Weiss W. W., 1999, A&AS, 138, 119 Kurucz R., Bell B., 1995, Atomic Line Data (R.L. Kurucz and B. Bell) Kurucz CD-ROM No. 23. Cambridge, Mass.: Smithsonian Astrophysical Observatory, 1995., 23

MNRAS 000, 1–12 (2016)

12 A.P. Doyle et al.

Kurucz R. L., Furenlid I., Brault J., Testerman L., 1984, Solar flux atlas from 296 to 1300 nm Meléndez J., Asplund M., Gustafsson B., Yong D., 2009, ApJL, 704, L66 Mortier A., Santos N. C., Sousa S. G., Fernandes J. M., Adibekyan V. Z., Delgado Mena E., Montalto M., Israelian G., 2013, A&A, 558, A106 Mortier A., Sousa S. G., Adibekyan V. Z., Brandão I. M., Santos N. C., 2014, A&A, 572, A95 Ryabchikova T., Piskunov N., Kurucz R. L., Stempels H. C., Heiter U., Pakhomov Y., Barklem P. S., 2015, Phys. Scr., 90, 054005 Schuler S. C., Flateau D., Cunha K., King J. R., Ghezzi L., Smith V. V., 2011, ApJ, 732, 55 Smalley B., Smith K. C., Dworetsky M. M., 2001, UCLSYN Userguide, http://www.astro.keele.ac.uk/∼bs/publs/uclsyn.pdf Smith K. C., 1992, Ph.D. Thesis, University of London Sousa S. G., et al., 2014, A&A, 561, A21 Sozzetti A., Torres G., Charbonneau D., Latham D. W., Holman M. J., Winn J. N., Laird J. B., O’Donovan F. T., 2007, ApJ, 664, 1190 Stassun K. G., Collins K. A., Gaudi B. S., 2016, preprint, (arXiv:1609.04389) Struve O., Elvey C. T., 1934, ApJ, 79, 409 Takeda Y., Ohkubo M., Sadakane K., 2002, PASJ, 54, 451 Torres G., Andersen J., Giménez A., 2010, A&AR, 18, 67 Torres G., Fischer D. A., Sozzetti A., Buchhave L. A., Winn J. N., Holman M. J., Carter J. A., 2012, ApJ, 757, 161 Winn J. N., 2011, in Seager S., ed., Exoplanets. University of Arizona Press, pp 55–77 Wittenmyer R. A., Jones M. I., Zhao J., Marshall J. P., Butler R. P., Tinney C. G., Wang L., Johnson J. A., 2017, AJ, 153, 51

APPENDIX A: LINE LIST

This paper has been typeset from a TEX/L^ATEX file prepared by the author.

MNRAS 000, 1–12 (2016)

HoSTS II 13

Table A1. The line list as used in uclsyn. The log gf values are are those created differentially to the Sun with v_{mic} = 1 km s^{−1}. The radiative damping constant and the Stark broadening factor are the inverse logs of the values given in VALD, as the inverse log values are required for uclsyn. The Van der Waals (VDW) damping constants are listed as they are in VALD for those with ABO values. VDW without ABO values are given as the inverse log. A temperature cutoff is given for some lines if they are too strong or blend above or below a certain T_{eff} . Lines that consistently have an EW > 0.12 Å are deemed to be too strong.

Element Wavelength EP log gf radiative VDW stark T_{eff} cutoff

Fe ii 4620.521 2.83 -3.292 3.63E+08 185.306 2.95E-07 Fe ii 4656.981 2.89 -3.737 3.63E+08 184.251 2.95E-07 Fe ii 4670.182 2.58 -4.016 3.47E+08 172.228 2.88E-07 Fe ii 4825.736 2.64 -4.957 3.55E+08 172.225 2.95E-07 Fe i 4939.686 0.86 -3.243 1.78E+07 244.246 7.08E-07 Fe ii 4993.358 2.81 -3.731 3.09E+08 172.22 2.95E-07 Fe i 4994.129 0.92 -3.186 1.74E+07 246.245 7.08E-07 Too strong in high [Fe/H] stars < 5800 K Fe ii 5000.743 2.78 -4.631 3.47E+08 173.22 2.88E-07 Too strong in high [Fe/H] stars < 5300 K Fe i 5016.476 4.26 -1.647 2.40E+08 982.279 4.07E-05 Fe i 5023.198 4.28 -1.544 2.40E+08 1013.279 1.74E-05 Fe i 5058.496 3.64 -2.773 3.39E+07 353.313 7.94E-07 Fe i 5079.740 0.99 -3.430 1.70E+07 248.244 7.08E-07 Fe i 5127.359 0.92 -3.353 1.86E+07 243.246 7.08E-07 Fe i 5127.679 0.05 -6.072 2.88E+03 1.51E-08 5.25E-07 Fe ii 5132.669 2.81 -4.120 3.47E+08 172.219 2.95E-07 Fe i 5151.911 1.01 -3.196 1.70E+07 248.245 7.08E-07 Blended < 5400 K Fe ii 5160.839 5.57 -2.000 3.02E+08 175.234 2.95E-07 Fe ii 5197.577 3.23 -2.300 2.88E+08 180.247 2.95E-07 Fe i 5217.389 3.21 -1.115 1.12E+08 815.232 4.17E-06 Too strong < 5800 K Fe i 5247.050 0.09 -4.973 4.27E+03 206.253 5.25E-07 Fe i 5250.209 0.12 -4.923 1.66E+03 207.253 5.25E-07 Too strong < 5000 K Fe ii 5264.812 3.23 -3.148 3.63E+08 186.3 2.95E-07 Fe i 5379.574 3.70 -1.485 7.08E+07 363.249 7.59E-07 Fe ii 5414.073 3.22 -3.651 3.63E+08 185.303 2.95E-07 Fe i 5421.849 4.55 -1.938 1.62E+08 1111.29 8.71E-06 Fe ii 5425.257 3.20 -3.318 2.88E+08 178.255 2.95E-07 Fe ii 5427.826 6.72 -1.557 3.24E+08 173.21 2.95E-07 Fe i 5441.354 4.31 -1.594 2.04E+08 807.278 2.00E-05 Fe i 5464.278 4.14 -1.577 9.77E+07 1.70E-08 5.50E-06 Fe i 5506.779 0.99 -2.835 1.45E+07 241.248 6.03E-07 Too strong < 5800 K Fe i 5522.447 4.21 -1.409 1.05E+08 744.215 2.69E-06 Blended < 5800 K Fe i 5538.517 4.22 -1.536 2.82E+08 3.31E-08 3.39E-05 Blended < 4900 K Fe i 5539.284 3.64 -2.609 3.24E+07 383.26 7.24E-07 Fe i 5549.948 3.70 -2.829 3.80E+07 373.316 8.51E-07 Fe i 5560.207 4.44 -1.095 1.91E+08 895.278 5.75E-05 Fe i 5576.090 3.43 -0.857 1.15E+08 854.232 4.07E-06 Too strong < 5800 K Fe i 5577.031 5.03 -1.495 7.59E+08 4.07E-08 5.13E-06 Fe i 5607.664 4.15 -2.228 4.07E+08 816.278 1.32E-05 Fe i 5608.974 4.21 -2.357 1.02E+08 733.214 4.57E-06 Fe i 5611.361 3.64 -2.929 1.45E+08 376.256 1.12E-06 Fe i 5618.631 4.21 -1.311 1.55E+08 732.214 2.69E-06 Fe i 5619.224 3.70 -3.182 3.63E+07 401.237 1.02E-06 Fe i 5633.975 4.99 -0.186 7.59E+08 635.27 8.51E-06 Fe i 5635.824 4.26 -1.602 2.29E+08 928.279 3.39E-05 Fe i 5636.696 3.64 -2.523 4.07E+07 368.31 8.91E-07 Fe i 5651.470 4.47 -1.801 1.86E+08 898.278 3.89E-06 Fe i 5652.320 4.26 -1.800 1.02E+08 754.21 2.69E-06 Fe i 5679.025 4.65 -0.761 1.62E+08 1106.291 8.71E-06 Fe i 5680.241 4.19 -2.349 4.90E+07 1.70E-08 9.33E-07

MNRAS 000, 1–12 (2016)

14 A.P. Doyle et al.

Table A1. Line list (continued)

Element Wavelength EP log gf radiative VDW stark T_{eff} cutoff

Fe i 5724.454 4.28 -2.549 6.46E+07 914.278 2.04E-05 Fe i 5741.846 4.26 -1.656 2.95E+08 725.232 2.69E-06 Fe i 5793.913 4.22 -1.642 2.95E+08 714.231 5.13E-06 Fe i 5806.717 4.61 -0.928 2.09E+08 985.281 1.95E-05 Fe i 5811.917 4.14 -2.337 4.07E+07 1.58E-08 9.55E-07 Fe i 5827.875 3.28 -3.226 1.66E+08 748.245 3.89E-06 Fe i 5849.682 3.70 -3.011 6.03E+07 379.305 1.32E-06 Fe i 5853.150 1.49 -5.097 2.14E+07 1.62E-08 7.59E-08 Fe i 5855.091 4.61 -1.575 2.14E+08 962.279 2.88E-05 Fe i 5856.083 4.29 -1.572 9.77E+07 404.264 5.50E-06 Fe i 5861.107 4.28 -2.399 2.40E+08 854.279 4.79E-05 Fe i 5905.689 4.65 -0.822 2.14E+08 994.282 1.74E-05 Fe i 5929.667 4.55 -1.237 2.14E+08 864.275 2.63E-05 Fe i 5930.173 4.65 -0.326 2.09E+08 983.281 1.95E-05 Too strong in high [Fe/H] stars < 5300 K Fe i 5934.653 3.93 -1.184 6.03E+07 959.247 5.13E-06 Fe i 5956.692 0.86 -4.527 1.00E+04 227.252 6.76E-07 Fe ii 5991.376 3.15 -3.593 3.47E+08 172.221 2.95E-07 Fe i 6012.206 2.22 -3.845 4.79E+06 309.27 1.67E+02 Blended > 5800 K Fe i 6024.049 4.55 0.014 2.09E+08 823.275 8.71E-06 Too strong in high [Fe/H] stars < 5800 K Fe i 6027.050 4.08 -1.073 1.02E+08 1.66E-08 9.33E-07 Fe i 6034.033 4.31 -2.397 1.95E+08 710.223 1.00E-05 Fe i 6055.992 4.73 -0.433 2.09E+08 1029.286 1.12E-05 Fe i 6065.482 2.61 -1.518 1.17E+08 354.234 5.13E-07 Too strong in high [Fe/H] stars < 5800 K Fe ii 6084.111 3.20 -3.815 3.47E+08 173.223 2.95E-07 Fe i 6093.666 4.61 -1.369 2.14E+08 866.274 2.69E-05 Fe i 6096.662 3.98 -1.844 5.62E+07 963.25 5.13E-06 Fe i 6098.280 4.56 -1.786 2.75E+08 797.269 2.00E-05 Fe ii 6113.322 3.22 -4.184 3.47E+08 173.228 2.95E-07 Fe i 6120.249 0.92 -5.915 1.00E+04 1.51E-08 6.76E-07 Fe ii 6149.250 3.89 -2.750 3.16E+08 186.269 2.95E-07 Blended < 5700 K Fe i 6151.617 2.18 -3.331 1.95E+08 277.263 6.92E-07 Fe i 6157.730 4.08 -1.135 7.76E+07 1.62E-08 9.33E-07 Fe i 6173.340 2.22 -2.885 2.04E+08 281.266 6.92E-07 Fe i 6187.987 3.94 -1.657 5.62E+07 903.244 4.17E-06 Fe i 6200.313 2.61 -2.330 1.20E+08 350.235 5.13E-07 Fe i 6213.429 2.22 -2.569 2.04E+08 280.265 6.92E-07 Fe ii 6239.366 2.81 -4.745 2.95E+08 167.219 2.95E-07 Blended > 5800 K Fe ii 6239.953 3.89 -3.481 3.16E+08 186.271 2.95E-07 Blended > 6000 K Fe i 6240.645 2.22 -3.309 6.46E+06 301.272 7.41E-07 Fe ii 6247.557 3.89 -2.383 3.16E+08 186.272 2.95E-07 Fe i 6252.554 2.40 -1.733 1.05E+08 326.245 8.51E-07 Too strong < 5800 K Fe i 6265.131 2.18 -2.514 2.00E+08 274.261 6.92E-07 Too strong 5200 K Fe i 6330.838 4.73 -1.185 2.57E+08 915.277 3.16E-05 Fe i 6335.340 2.20 -2.254 2.00E+08 275.261 6.92E-07 Too strong < 5700 K Fe ii 6369.462 2.89 -4.188 2.95E+08 169.204 2.95E-07 Fe i 6392.538 2.28 -3.939 2.04E+08 310.243 6.92E-07 Fe i 6400.318 0.92 -4.153 2.69E+04 1.48E-08 6.31E-07 Fe ii 6432.680 2.89 -3.555 2.95E+08 169.204 2.95E-07 Fe ii 6446.410 6.22 -2.001 4.37E+08 181.214 2.95E-07 Fe ii 6456.383 3.90 -2.028 3.16E+08 185.276 2.95E-07 Fe ii 6482.204 6.22 -1.830 3.31E+08 181.212 2.95E-07 Fe i 6498.938 0.96 -4.629 2.29E+04 226.253 6.17E-07 Fe i 6593.871 2.43 -2.302 1.02E+08 321.247 8.32E-07 Too strong < 5200 K Fe i 6608.024 2.28 -3.958 2.00E+08 306.242 6.92E-07 Fe i 6625.022 1.01 -5.340 1.15E+04 1.48E-08 6.17E-07 Fe i 6627.540 4.55 -1.503 2.14E+08 754.209 4.57E-06 Fe i 6646.940 2.61 -3.957 9.12E+07 339.243 8.32E-07 Fe i 6699.150 4.59 -2.125 1.23E+08 297.273 2.34E-06 Fe i 6703.568 2.76 -3.019 1.20E+08 320.264 5.25E-07

MNRAS 000, 1–12 (2016)

HoSTS II 15

Table A1. Line list (continued)

Element Wavelength EP log gf radiative VDW stark T_{eff} cutoff

Fe i 6710.316 1.49 -4.774 1.86E+07 252.246 7.08E-07 Fe i 6725.353 4.10 -2.209 2.51E+08 897.241 4.17E-06 Fe i 6732.070 4.58 -2.177 6.61E+07 274.26 4.27E-06 Fe i 6733.151 4.64 -1.451 2.57E+08 781.273 4.37E-06 Fe i 6745.970 4.08 -2.711 3.09E+07 1.51E-08 9.77E-07 Fe i 6750.150 2.42 -2.564 4.90E+06 335.241 7.41E-07 Fe i 6752.705 4.64 -1.212 2.63E+08 778.274 3.39E-06 Fe i 6806.847 2.73 -3.112 1.17E+08 313.268 8.13E-07 Fe i 6810.257 4.61 -0.980 2.63E+08 873.275 5.89E-06 Fe i 6837.016 4.59 -1.718 7.08E+07 273.258 7.59E-07 Fe i 6839.840 2.56 -3.333 1.12E+08 330.248 8.71E-07 Fe i 6842.679 4.64 -1.206 2.24E+08 896.279 2.04E-05 Fe i 6857.243 4.08 -2.067 1.70E+07 1.51E-08 9.33E-07 Fe i 6858.145 4.61 -0.953 2.69E+08 765.211 2.69E-06 Fe i 6862.492 4.56 -1.419 3.89E+08 804.269 1.32E-05

MNRAS 000, 1–12 (2016)