arXiv:1702.05621v1 [astro-ph.IM] 18 Feb 2017

UCAC5: New Proper Motions using Gaia DR1

N. Zacharias^1, C. Finch^1, J. Frouard^1

nz@usno.navy.mil

ABSTRACT

New astrometric reductions of the US Naval Observatory CCD Astrograph Catalog (UCAC) all-sky observations were performed from first principles using the TGAS stars in the 8 to 11 magnitude range as reference star catalog. Significant improvements in the astrometric solutions were obtained and the UCAC5 catalog of mean positions at a mean epoch near 2001 was generated. By combining UCAC5 with Gaia DR1 data new proper motions on the Gaia coordinate system for over 107 million stars were obtained with typical accuracies of 1 to 2 mas/yr (R = 11 to 15 mag), and about 5 mas/yr at 16th mag. Proper motions of most TGAS stars are improved over their Gaia data and the precision level of TGAS proper motions is extended to many millions more, fainter stars. External comparisons were made using stellar cluster fields and extragalactic sources. The TGAS data allow us to derive the limiting precision of the UCAC x, y data, which is significantly better than 1/100 pixel.

Subject headings: astrometry, proper motions

1. Introduction

The very successful European Space Agency (ESA) Gaia mission is in progress. In September 2016 the first Gaia data were released based on the first 14 months of regular in-orbit operations (Prusti et al. 2016). Accurate mean observed positions for the 2015.0 epoch were provided for a total of over 1.1 billion stars down to about magnitude G = 20.7 with a median position error of about 1.8 and 1.6 mas for RA and Dec respectively (Lindegren et al. 2016). A full 5-parameter (position, proper motion, parallax) astrometric solution was obtained for just over 2 millions of stars, a subset of about 80% of the Hipparcos and Tycho- 2 stars, by using the Hippacos satellite observations of mean epoch 1991.25 together with the Gaia observations to resolve the proper motion and parallax degeneracy. The accuracy of these positions varies as function of magnitude and location on the sky with a median near 0.3 mas per coordinate and a median error in proper motion of 1.1 and 0.9 mas/yr for RA and Dec, respectively (Lindegren et al. 2016).

1U.S. Naval Observatory, Washington DC

The U.S. Naval Observatory (USNO) is engaged in producing astrometric star catalogs. The USNO CCD Astrograph Catalog (UCAC) project provided such all-sky data to 16th magnitude with its most recent 4th data release, the UCAC4 (Zacharias et al. 2013). The Tycho-2 catalog (Høg et al. 2000) was used as reference star catalog for those wide-field CCD observations. Comparisons between the Tycho-Gaia Astrometric Solution (TGAS) and Tycho-2 proper motions showed that the latter have large skycorrelated systematic errors of up to a few mas/yr (Lindegren et al. 2016) due to previously undiscovered large systematic errors in the early epoch Astrographic Catalog data from around 1900, which were used for Tycho-2 proper motions. A re-reduction of the UCAC data using TGAS as described in this paper provides a significantly improved product, the UCAC5.

Although the UCAC has positional accuracies not reaching those of the Gaia data, the first Gaia Data Release (DR1) is lacking proper motion data for all stars fainter than the Tycho-2 limit of about 11th magnitude. The upcoming DR2 release, currently scheduled for early 2018 (Altmann et al.

2017) will change that. New proper motions for about 50 times more stars than contained in TGAS can now be obtained by combining UCAC data at a mean epoch of 2001 with Gaia position data at epoch 2015. The accuracy of those proper motions is comparable to those of TGAS up to about R = 15.0 and provide valuable additional observations of TGAS stars themselves to noticably improve their proper motions.

2. UCAC re-reduction

2.1. Astrometric solution

A summary of the relevant features of the UCAC program and data is provided in Table 1. All applicable individual UCAC exposures obtained from Cerro Tololo Interamerican Observatory (CTIO) and the Naval Observatory Flagstaff Station (NOFS) were matched with the Gaia TGAS data which served as reference star catalog. A new astrometric reduction was performed adopting the systematic corrections of the UCAC x, y data as function of magnitude which were previously established using the 2MASS (Skrutskie et al. 2006) data covering the full UCAC magnitude range. For more details please see the UCAC4 paper (Zacharias et al. 2013).

However, the systematic errors as a function of location in the focal plane (the field distortion pattern) as well as the systematic errors as function of the sub-pixel phase were re-evaluated and updated using the TGAS residuals separately for the CTIO and NOFS UCAC data set. The distortion pattern is mainly determined by the lens and dewar window but also depends on the actual tilt of the focal plane with respect to the optical axis which will change after disassemble and deployment at a new site. The pixel-phase errors strongly depend on the average width of the image profiles and thus also change from site to site.

After applying the new corrections, mean residuals as a function of location in the field of view and sub-pixel phase were reduced to about 2 mas. For illustration the new field distortion pattern from the CTIO data is shown in Fig. 1.

As before a 6-parameter, linear plate model was adopted for the astrometric solution, split into orthogonal (a to d) and non-orthogonal parameters (e and f):

ξ = ax + by + c + ex + fy

η = −bx + ay + d + fx − ey Here ξ, η are the standard coordinates (scaled from radian to arcsec) and x, y the observed center coordinates of star images on the CCD (scaled from pixel unit to arcsec).

Fig. 2 shows the distribution of the number of reference stars used per individual UCAC exposure. The mean is about 50, corresponding to the average sky density of the TGAS catalog and the UCAC 1.0 square degree field of view. The astrometric solution errors are presented in Fig. 3 separately for the short and long exposure. These errors include the x, y center errors of the observed image profiles, the reference star catalog errors and the error contribution from the turbulent atmosphere. The latter scales inversely with the square-root of integration time and apparently is a significant contribution for the short exposures. The same is shown for UCAC4 data in Fig. 4. The vast improvement using (almost) error free TGAS reference stars is striking, showing the high precision of the UCAC observations, which previously were overshadowed by the Tycho-2 reference star errors.

Fig. 5 shows residuals as a function of calibrated, UCAC bandpass magnitude for CTIO data. This is likely the largest remaining contribution to systematic errors in the UCAC data, caused by the poor charge-transfer efficiency (CTE) of that particular detector (Zacharias et al. 2004). No attempt to improve the model was made here because the TGAS reference stars have a limiting magnitude of about 11.5 while the UCAC data reaches beyond 16th magnitude.

2.2. Positions

Using the above described model, positions of all observed objects were obtained at their epoch of observation for all applicable CCD exposures. Fig. 6 shows the mean observed epoch as a function of declination. The UCAC survey began in the south and ended at the north celestial pole.

Mean observed UCAC5 positions were obtained from a weighted mean of the individual positions

(images). Outliers were rejected as much as possible with the small number of observations available for this task. Fig. 7 shows the distribution of the number of observations used for the mean positions. In cases with a total of 2 images which display discrepant positions, the outlier can not be identified and an unweighted mean position is given with the number of used images set to zero.

Due to the small field of view and the desire to cover all-sky, the number of observations per star is small. A 2-fold (center-in-corner) overlap pattern was adopted, with a short and long exposure on each field to extend the dynamic range. Thus stars in the 8 to 9.5 mag range typically have 2 images (from the short exposures only), stars in the 9.5 to about 14.5 mag range usually have 4 images (short and long exposure), while stars fainter than about R = 14.5 show up only on the long exposures.

The errors on the UCAC5 positions were obtained from the formal errors (x, y center errors plus astrometric solution error propagation) of the individual images used for the mean position. A 10 mas term was added in quadrature to account for possible remaining systematic errors and to provide a more realistic error floor for the small number statistics of individual stars. This error floor is likely dominated by the remaining systematic errors as a function of magnitude and the same value as in the earlier UCAC4 reductions was adopted here because no changes in the calibration model for those errors were made.

2.3. Adding NOMAD data to Gaia DR1

The Naval Observatory Merged Astrometric Dataset (NOMAD) catalog (Zacharias et al. 2005) contains about a billion entries, covers allsky, and the magnitude range from naked eye stars to about V = 20 mag. It contains positions, proper motions, optical and near IR magnitudes. NO- MAD positions were updated to the 2015 epoch using its proper motions and then matched to the Gaia DR1 data. Over 638 million sources were matched within 1 arcsec based on position only. A new, internal catalog was created, which adds NOMAD data, if available, to all sources in Gaia DR1.

These new proper motions are of value for stars not contained in the UCAC data, thus mainly for stars fainter than about R = 16 mag. The new proper motion data for stars in common with UCAC data are very helpful to correctly match UCAC stars to the Gaia data, particularly for stars with moderate to large proper motions (see below).

3. Results

3.1. Position error analysis

Having results from largely different exposure times allows us to determine the individual error contributions of the UCAC observations. The astrometric solution error, σ_S , has 3 components, the errors of the reference star catalog σ_r at epoch of observations, the x, y data error σ_{xy}, and the error introduced by the turbulence in the atmosphere, σ_a,

σ^2_S = σ^2_r + σ^2_{xy} + σ^2_a

The variance of the error contribution from the atmosphere scales inversely with exposure time, t,

σ^2_a = σ^2_0 /t

while the other 2 error contributions are independent of exposure time. The reference star errors in the magnitude range used here (mostly G = 9 to 11) are mainly a function of epoch (see below), and the x, y errors are nearly constant for these high S/N data. We define

σ^2_c = σ^2_r + σ^2_{xy}

leading to

σ^2_S = σ^2_c + σ^2_0 /t

For 2 different exposure times we thus have 2 linear equations with known σ_S to directly solve for σ_c, and σ_0. From Fig. 3 we see the peaks of the UCAC5 astrometric solution errors, σ_S at 29 mas for the short exposures (on average 25 sec), and 19 mas for the long exposures (on average 125 sec). The peak values of these distributions can be interpreted as “typical good quality” observations. With these numbers we get σ_0 = 122 mas sec^{1/2}, the error contribution from the atmosphere, and σ_c = 15.5 mas, the RMS combined error of the reference stars and the x, y centroiding error.

The reference star errors at the mean UCAC epoch of 2001 are dominated by proper motion errors. From (Lindegren et al. 2016) we see that for TGAS stars not in the Hipparcos sample the median proper motion errors are about 1.1 and 0.9 mas/yr for the RA and Dec component, respectively. Assuming 1.0 mas/yr here and an average epoch difference of 14 years between the UCAC and the TGAS positions, we have an estimate of σ_r = 14 mas. This allows us to solve for the last remaining error contribution, σ_{xy} = 6.7 mas.

This error includes random centroiding errors as well as remaining, uncorrected systematic errors for example as a function of pixel phase, location in the field of view, and magnitude (over the range of the reference star magnitudes). Note, σ_{xy} is the average position error of high S/N UCAC observations per coordinate and per exposure (which is 1/135 pixel). Assuming the error contributions of the reference stars and those of the atmosphere are small, the obtained observational precision then is limited by σ_{xy}. The former will soon be obtained with the 2nd Gaia data release, and the latter can be achieved with long integration times.

The image center algorithm used to derive the UCAC x, y data from the pixel data is a weighted least-square fit with a 2-dimensional Gaussian model followed by extensive empirical modelling of the pixel-phase and other systematic errors. No elaborate PSF fitting was performed, instead the high precision was obtained by analyzing and modeling the position residuals. Details are described in (Zacharias et al. 2004).

3.2. UCAC5–Gaia proper motions

The Gaia plus NOMAD data catalog positions were propagated to a mean epoch of 2001 and then matched with the UCAC5 observational catalog. Again, a match was assumed if the position difference is within 1 arcsec in each coordinate. This resulted in 107.7 million stars in common between the UCAC and Gaia data. New proper motions were calculated for all those stars based on the 2 epoch positions (Gaia at 2015, UCAC5 at about 2001) with a mean epoch difference of about 14 years. No NOMAD positional data were used for these proper motions. The NOMAD data only served to facilitate the proper match, thus providing also results for stars with large proper motion.

Errors of the proper motions were obtained from the formal position errors of Gaia and UCAC5 and the epoch difference of individual stars. Fig. 8 shows the distribution of the proper motion errors. This distribution peaks at about 1.2 mas/yr which is comparable to the TGAS proper motion errors, but for many millions of more stars.

Fig. 9 shows the strong dependence of our proper motion errors with brightness. Errors in proper motion slowly increase to 2.5 mas/yr at about magnitude 15 and then rapidly increase to about 10 mas/yr at the limiting magnitude of 16.5 due to the low S/N of faint stars.

Table 2 lists the data items of our UCAC5 catalog. Positions are given at the mean UCAC observed epoch for each star on the Gaia reference frame. The UCAC5 binary data file, sorted by declination is 4.3 GB large and will be available from the Centre de Données astronomiques de Strasbourg (CDS).

3.3. Close doubles

A match of UCAC5 with itself was performed revealing some 52,000 multiple matches within 2 arcsec. Spot checks indicate 2 types of cases. The first case are close pairs in Gaia DR1, i.e. 2 real stars which are matched to the same UCAC observation i.e. the photocenter of the pair which is unresolved in the UCAC data. The second case are close doubles seen as 2 stars in both, Gaia and UCAC data. No stars identified in this investigation were removed from the published catalog. The Gaia DR1 source identifier remains unique within the UCAC5 catalog, because the DR1 entries were used as initial input list. However, in a few cases the same UCAC object is matched to 2 different DR1 entries. No duplicate entries, i.e. entries with positions identical to within a few mas were found in UCAC5.

3.4. Comparison to TGAS

A separate, formatted data file is available for the 2,054,491 stars in common between TGAS and UCAC5, which also lists the differences in proper motion (UCAC5 - TGAS). The TGAS proper motions use the Gaia observations (at epoch 2015) together with the Hipparcos observations of these stars (at epoch 1991). The UCAC5 proper motions are based on the astrograph observations at a mean epoch of about 2001 and the Gaia 2015 observations. Of course these proper motions are somewhat correlated, both use the same later epoch data but different early epoch observations. Furthermore, the UCAC5 data uses TGAS stars as reference stars which include use of TGAS proper motions. However, the UCAC5 epoch observations are largely independent, new observations due to the fact that typically 20 to 200 such reference stars are used in the astrometric solutions of UCAC observations with a simple, linear model of 6 parameters, which provide a large degree of overdetermination in the least-squares reductions.

The distribution of UCAC5 proper motions is shown in Fig. 10. The distribution of the differences in proper motions are small (Fig. 11). The formal errors of proper motions for stars in common are shown in Fig. 12 and 13 for the TGAS and UCAC5 data, respectively. Both proper motions are similar in performance. TGAS has more stars with about 1 mas/yr or less errors, while the UCAC5 proper motions are somewhat better for stars with about 2 mas/yr TGAS proper motion errors and above.

4. External comparisions

4.1. Star Cluster

As an example of astrophysical application and validation of the UCAC5 proper motions, 2 cluster areas were picked with a box size of 30 arcmin. In Fig. 14 UCAC5 proper motions of all such stars in the open cluster NGC 3532 area are shown in comparison to the fourth release of the Southern Proper Motion (SPM4) program (Girard et al. 2011) proper motions, the previous “gold standard” for absolute proper motions of faint stars. Fig. 15 shows the same for the area around the globular cluster NGC 6397. A significant improvement in the ability to separate cluster member stars from non-cluster stars is seen with the UCAC5 proper motions as compared to the SPM4 proper motions.

4.2. Extragalactic Sources

Due to their extreme distance, extragalactic sources will have negligible proper motions. Thus the observed proper motions show the limitations of the catalog data. A match of UCAC5 with LQAC3 (Souchay et al. 2015) was performed, which lists over 321,000 confirmed extragalactic sources, mostly QSOs. A total of 2001 LQAC3 sources are in common with the UCAC5 within 1.5 arcsec.

Table 3 summarizes results for selected subsets, per coordinate and for the proper motions in mas/yr as well as for their normalized values (proper motion divided by formal error of the proper motion of that object). Subsets were selected by minimum number of UCAC observations used for the mean UCAC5 position (nu), the LQAC3 catalog object type (R = astrometric radio source, Q = QSO, others include AGN and BL-Lac objects), the UCAC5 bandpass mean observed magnitude (mag), and the redshift z. The total number of objects for each set is also given, while 80% of these are used to derive the mean and RMS results, excluding the top and bottom 10% of the data after sorting (to prevent outliers to affect this analysis). The entry “all” in Table 3 means no restriction has been applied for that particular column item. The last 2 lines in Table 3 list results for sources in common with the 2nd version of the International Celestial Reference Frame (ICRF2). The ICRF2 (Fey, Gordon, & Jacobs 2009) currently defines the inertial coordinate system on the sky, and is derived from highly accurate, radio, very long baseline interferometry (VLBI), observations of compact, extragalactic sources.

For most data sets a small, negative offset in the mean UCAC5 proper motions of about −0.5 mas/yr is seen, while the ICRF sources do not show this. The RMS scatter of the observed proper motions is larger than the formal errors for most data sets. However, when excluding low redshift sources the RMS scatter is significantly reduced.

5. Discussion and Conclusions

High quality, ground-based observations to obtain positions up to now were impacted by relatively poor reference star data. The TGAS catalog now shows the full potential of such observations. Future Gaia data with even more accurate positions and for many more, fainter stars will have a big impact on such ground-based observations for example in time-domain astronomy. The quality of the telescope and instrument will be more important than ever before. The limitation of the USNO redlens astrograph data can be expected to be significantly below 1/100 of a pixel per coordinate for single, long exposure observations of high S/N stars.

The UCAC5 positions on the Gaia coordinate system provide additional data of similar quality to the Hipparcos mission Tycho star observations and thus have the potential to improve the TGAS proper motions. UCAC5 provides new, accurate proper motions for millions of more stars fainter than TGAS, which will allow astronomers to have a preview into research possible only with the next Gaia data release. At the faint end UCAC5 proper motion errors are relatively large due to the low S/N ratio of these observations. Better proper motions for stars fainter than about 15th mag are available from proper motions obtained by combining NOMAD with Gaia DR1 (catalog of 503 million stars is available upon request), or the recently published PPMXL re-reduction, called the HSOY (Altmann et al. 2017) catalog.

The biggest issue with the UCAC5 data remains the problematic corrections of systematic errors as a function of magnitude due to the poor CTE of the CCD used in the program. However, the remaining systematic positional errors are expected to not exceed 10 mas over the entire magnitude range of UCAC data (verified with TGAS data for the 8 to 11 mag range), which can lead to systematic errors in the UCAC5 proper motions up to 0.7 mas/yr. This is confirmed with comparisons to extragalactic sources.

Restricting the sample of extragalactic sources to redshift of 0.5 or higher results in a significant reduction in the UCAC5 observed proper motion scatter. This is another indication for possible optical structure of nearby extragalactic source affecting the observed image centers. Both epochs (UCAC and Gaia) used for these proper motions are based on optical data, however, the resolution of Gaia is at least 10 times higher than that of the astrograph. It appears that both instruments “see” a different photocenter at least for cosmological nearby sources, resulting in a larger scatter of the proper motions, despite the fact that they are typically brighter with smaller formal position errors than more distant sources.

We used the PostgreSQL Q3C sky-indexing scheme for some of our external catalog comparisons (Koposov & Bartunov 2006), as well as the Department of Defense Celestial Database of the USNO Astrometry Department, developed by V.Makarov, C.Berghea, and J.Frouard. Pgplot by California Institute of Technology was used to produce plots. The gfortran and g77 compilers were used for code development.

REFERENCES

Altmann, M., Röser, S., Demleitner, D., Bastian, U., & Schilbach, E., 2017, Letter to A&A, in press (HSOY)

Fey, A.L., Gordon, D., & Jacobs, S. (eds.) 2009, IERS Technical Note No. 35, ISBN 3-89888- 918-6 (print version)

Girard, T.M., van Altena, W.F., Zacharias, N., Viera, K., Casetti-Dinescu, D.I., Castillo, D., Herrera, D., Lee, Y.S., Beers, T.C., Monet, D.G., Lopez, C.E. 2011, AJ 142, 15 (SPM4)

Høg, E. Fabricius, C., Makarov, V., Urban, S., Corbin, T., Wycoff, G., Bastian, U., Schwedendiek, P., Wicenec, A. 2000, A&A, 355, L27 (Tycho-2)

Koposov, S., & Bartunov, O., 2006, in ASP Conf.

Ser. 351, Astronomical Data Analysis Software and Systems XV, ed. C. Gabriel et al. (San Francisco CA: ASP), 375

Lindegren, L. et al. 2016, A&A, 595, A4 (Gaia)

Prusti, T. et al. 2016, A&A, 595, A1 (Gaia)

Souchay, J., Andrei, A.H., Barache, C. et al. 2015, A&A 583, A75 (LQAC3)

Skrutskie, M.F., Cutri, R.M., Stiening, R. et al.

2006, AJ, 131, 1163 (2MASS)

Zacharias, N., Urban, S.E., Zacharias, M.I., Wycoff, G.L., Hall, D.M., Monet, D.G., Rafferty, T.J. 2004, AJ 127, 3043 (UCAC2)

Zacharias, N., Monet, D.G., Levine, S.E., Urban, S.E., Gaume, R., Wycoff, G.L., 2005, NOMAD Catalog, 2005yCat.1297...OZ, VizieR On-line Data Catalog: I/297

Zacharias, N. Finch, C.T., Girard, T.M., et al.

2013, AJ, 145, 44 (UCAC4)

This 2-column preprint was prepared with the AAS L^ATEX macros v5.2.

Fig. 1.— Field distortion pattern of the UCAC instrument from TGAS reference star residuals of all applicable exposures taken at CTIO. The vectors are scaled by a factor of 5000. The largest residual vectors are about 25 mas long. Fig. 2.— Distribution of the number of reference stars used in the UCAC5 astrometric reductions (TGAS stars) per individual exposure. The last bin sums up all exposures with 200 and more reference stars.

Fig. 3.— Distribution of astrometric solution error of UCAC5 individual exposures using TGAS reference stars and the new systematic error model. The top diagram shows the results for the short exposures (20, 25, 30 sec) while results for the long exposures (100, 125, 150 sec) are shown in the histogram at the bottom.

Fig. 4.— Same as the previous figure but for the UCAC4 results using Tycho-2 reference stars.

Fig. 5.— UCAC5 residuals (along x = RA top, along y = Dec bottom) as a function of calibrated UCAC bandpass magnitude from data taken at CTIO (long and short exposures together). Each dot is the mean of 5000 residuals.

Fig. 6.— UCAC5 mean observing epoch as a function of declination.

Fig. 7.— Distribution of number of observations (individual exposures) used for the mean UCAC5 position. For objects in the zero bin see text.

Fig. 8.— Distribution of errors in proper motion of our UCAC5-Gaia catalog (RA on top, Dec on the bottom).

Fig. 9.— Errors of proper motions of the UCAC5- Gaia catalog as function of UCAC magnitude.

Fig. 10.— Distribution of UCAC5 proper motions of stars in common between UCAC5 and TGAS, for RA (top), and Declination (bottom).

Fig. 11.— Differences between TGAS and UCAC5 proper motions for RA (top) and Declination (bottom).

Fig. 12.— Formal errors of TGAS proper motions of stars in common between UCAC5 and TGAS, for RA (top), and Declination (bottom).

Fig. 13.— Formal errors of UCAC5 proper motions of stars in common between UCAC5 and TGAS, for RA (top), and Declination (bottom).

Fig. 14.— SPM4 (top) and UCAC5 (bottom) proper motions (pmr = along RA, pmd = along Dec) of stars in common between UCAC5 and SPM4 in the 30 arcmin area around the open cluster NGC 3532.

Fig. 15.— SPM4 (top) and UCAC5 (bottom) proper motions (pmr = along RA, pmd = along Dec) of stars in common between UCAC5 and SPM4 in the 30 arcmin area around the globular cluster NGC 6397.

Table 1: Summary of relevant UCAC data.

astrograph aperture = 208.0 mm
focal length (f/10) = 2060.0 mm
image scale = 100.5 arcsec/mm
fixed bandpass = 579 - 643 nm
field of view (lens) = 9 deg diameter

number of pixels CCD = 4k by 4k (Kodak front illum.)
pixel size = 9.0 micrometer
pixel scale = 0.905 arcsec/px
field of view CCD = 1.02 by 1.02 deg
typical FWHM images = 1.7 to 2.5 px

observing at CTIO = 1997-2001 (Dec = -90 to +25)
observing at NOFS = 2001-2004 (Dec = +25 to +90)
survey pattern = 2-fold, center-corner
long exposures = 150 or 125 or 100 sec
short exposures = 1/5 of long exposure

total number of exposures taken = 274,000
number of acceptable exposures = 218,000

Table 2: Data columns of UCAC5 catalog.

column name unit description 1 srcid Gaia source ID 2 flg 1 = TGAS, 2 = not TGAS, in NOMAD, 3 = neither 3 nu number of images used for mean position 4 epoc 1/1000 yr mean UCAC epoch (after 1997.0) 5 ira mas mean UCAC RA at epoch (item 4) 6 idc mas mean UCAC Dec at epoch (item 4) 7 pmra 0.1 mas/yr proper motion RA*cosDec 8 pmdc 0.1 mas/yr proper motion Dec 9 pmer 0.1 mas/yr formal error of proper motion RA*cosDec 10 pmed 0.1 mas/yr formal error of proper motion Dec 11 gmag mmag Gaia DR1 G magnitude 12 umag mmag mean UCAC model magnitude 13 Rmag mmag photographic R magnitude from NOMAD 14 Jmag mmag 2MASS J magnitude 15 Hmag mmag 2MASS H magnitude 16 Kmag mmag 2MASS K magnitude

Table 3: UCAC5 proper motions of extragalactic soruces from LQAC3.

nu obj. mag z total mean [mas] RMS [mas] norm. mean norm. RMS ≥ type ≤ ≥ n.obj. μ_α μ_δ μ_α μ_δ μ_α μ_δ μ_α μ_δ 2 all all all 1108 −0.42 −0.70 4.59 4.53 −0.11 −0.20 1.14 1.11 2 R,Q all all 461 0.05 −0.39 3.76 4.20 0.02 −0.12 0.87 0.99 2 all 15.8 all 541 −0.99 −0.99 4.88 4.34 −0.32 −0.33 1.58 1.48 2 R,Q 15.8 all 167 −0.83 −0.31 3.74 3.87 −0.24 −0.13 1.36 1.42 2 R,Q all 0.5 180 −0.21 −0.08 4.06 4.50 −0.04 −0.06 0.94 1.00 2 all all 0.5 184 −0.22 −0.09 4.14 4.50 −0.03 −0.07 0.96 1.00 1 ICRF all all 184 0.17 0.37 4.64 4.45 0.05 −0.01 0.81 0.81 2 ICRF all all 124 0.01 0.28 3.20 3.39 0.02 −0.03 0.86 0.86