arXiv:1702.04867v4 [astro-ph.GA] 23 Jan 2018

Accepted for publication in ApJ Preprint typeset using L^ATEX style emulateapj v. 04/17/13

FULL-DATA RESULTS OF HUBBLE FRONTIER FIELDS:

UV LUMINOSITY FUNCTIONS AT Z ∼ 6 − 10 AND A CONSISTENT PICTURE OF COSMIC REIONIZATION

Masafumi Ishigaki^{1,2}, Ryota Kawamata^3, Masami Ouchi^{1,4}, Masamune Oguri^{2,4,5}, Kazuhiro Shimasaku^{3,5}, and Yoshiaki Ono^1 Accepted for publication in ApJ

ABSTRACT We present UV luminosity functions of dropout galaxies at z ∼ 6 − 10 with the complete Hubble Frontier Fields data. We obtain a catalog of ∼ 450 dropout-galaxy candidates (350, 66, and 40 at z ∼ 6 − 7, 8, and 9, respectively), whose UV absolute magnitudes reach ∼ −14 mag, ∼ 2 mag deeper than the Hubble Ultra Deep Field detection limits. We carefully evaluate number densities of the dropout galaxies by Monte-Carlo simulations, including all lensing effects such as magnification, distortion, and multiplication of images as well as detection completeness and contamination effects in a self-consistent manner. We find that UV luminosity functions at z ∼ 6 − 8 have steep faint-end slopes, α ∼ −2, and likely steeper slopes, α ≲ −2 at z ∼ 9 − 10. We also find that the evolution of UV luminosity densities shows a non-accelerated decline beyond z ∼ 8 in the case of M_{trunc} = −15, while an accelerated in the case of M_{trunc} = −17. We examine whether our results are consistent with the Thomson scattering optical depth from the Planck satellite and the ionized hydrogen fraction Q_{HII} at z ≲ 7 based on the standard analytic reionization model. We find that there exist reionizaiton scenarios that consistently explain all the observational measurements with the allowed parameters of f_{esc} = 0.17^{+0.07}_{−0.03} and M_{trunc} > −14.0 for log ξ_{ion}/[erg^{−1} Hz] = 25.34, where f_{esc} is the escape fraction, M_{trunc} is the faint limit of the UV luminosity function, and ξ_{ion} is the conversion factor of the UV luminosity to the ionizing photon emission rate. The length of the reionization period is estimated to be Δz = 3.9^{+2.0}_{−1.6} (for 0.1 < Q_{HII} < 0.99), consistent with the recent estimate from Planck.

Keywords: galaxies: formation – galaxies: evolution – galaxies: high-redshift

1. INTRODUCTION

Understanding the sources of cosmic reionization is one of the goals of modern astronomy. Observational studies show that the reionization occurred at z ≳ 6 (Fan et al. 2006; Pentericci et al. 2011, 2014; Ono et al. 2012; Totani et al. 2006, 2014; Kashikawa et al. 2011; Ouchi et al. 2010; Konno et al. 2014; Treu et al. 2013). Major sources of the cosmic reionization are thought to be star-forming galaxies. Recent studies indicate that UV luminosity functions of the star-forming galaxies have steep faint-end slopes at z ≳ 6 (Bouwens et al. 2015; Schenker et al. 2013; McLure et al. 2013), which suggests that the ionizing photons are mainly supplied by faint galaxies. However, high-z galaxy observations, such as Hubble Ultra Deep Field, can reach the limiting absolute magnitudes down to ≲ −16 mag at z ≳ 6. The abundance of galaxies is not well known at the magnitude fainter than ∼ −16 where contributions to ionizing photon budget may be dominated. Moreover, there exist large uncertainties of various parameters to estimate an ionizing photon emission

ishigaki@icrr.u-tokyo.ac.jp

1 Institute for Cosmic Ray Research, The University of Tokyo, 5-1-5 Kashiwanoha, Kashiwa, Chiba 277-8582, Japan 2 Department of Physics, Graduate School of Science, The University of Tokyo, 7-3-1 Hongo, Bunkyo-ku, Tokyo 113-0033, Japan_3

Department of Astronomy, Graduate School of Science, The University of Tokyo, 7-3-1 Hongo, Bunkyo-ku, Tokyo 113-0033, Japan_4

Kavli Institute for the Physics and Mathematics of the Universe (Kavli IPMU, WPI), The University of Tokyo, 5-1-5 Kashiwanoha, Kashiwa, Chiba 277-8583, Japan

5 Research Center for the Early Universe, The University of Tokyo, 7-3-1 Hongo, Bunkyo-ku, Tokyo 113-0033, Japan

rate from the galaxy abundance obtained by observations. One of the important parameters is the numerical factor ξ_{ion} that converts a UV luminosity density to the ionizing photon emission rate of a star-forming galaxy. Bouwens et al. (2016a) estimated that log ξ_{ion}/[erg^{−1} Hz] has a mean value of 25.34 ± 0.02, albeit at z ∼ 4 − 5, the post-reionization epoch. (see also Nakajima et al. (2016) for the recent studies of ξ_{ion}). Another important parameter is the escape fraction of ionizing photons f_{esc}, which is the fraction of the number of escaping ionizing photons to that of ionizing photons produced in a galaxy. Steidel et al. (2001) estimated that the average value of f_{esc} is ∼ 0.1 at z ∼ 3 (see also Shapley et al. 2006; Iwata et al. 2009; Nestor et al. 2011; Japelj et al. 2017). Ono et al. (2010) investigated the stellar populations of Lyα emitters at z ∼ 6, and obtained weak upper limits of f_{esc} ∼ 0.6 at z = 5.7 and f_{esc} ∼ 0.9 at z = 6.6, based on the constraints on the nebular emission line fluxes. Although many constraints are given by these studies, reasonable constraints on ξ_{ion} and f_{esc} at the epoch of reionization have not been obtained so far.

Gravitational lensing is an effective tool for studying high-redshift galaxies. Cluster Lensing And Supernova survey with Hubble (CLASH; Postman et al. 2012) has discovered many candidates of faint galaxies at z ≳ 6 strongly lensed by galaxy clusters. In October 2013, Hubble Frontier Fields (HFF; PI: Lotz) program has started observing six massive clusters: Abell 2744, MACSJ0416, MACSJ0717, MACSJ1149, AbellS1063, and Abell370 (Lotz et al. 2017). The HFF program achieves the limiting magnitudes ∼ 29 AB mag at the 5σ level, which are ∼ 1 mag deeper than those of CLASH.

2 Ishigaki et al.

Many groups study the properties of high-redshift galaxies using a part of the HFF data (Atek et al. 2015a,b; Zheng et al. 2014; Coe et al. 2015; Oesch et al. 2015; Ishigaki et al. 2015, 2016; Kawamata et al. 2015, 2016; Livermore et al. 2017; Bouwens et al. 2017a,b; McLeod et al. 2015, 2016). In September 2016, the observations for all of the six HFF clusters are completed. Here we exploit the full six cluster HFF data to investigate the galaxies at the reionization epoch.

In this paper, we first present details of the HFF data in Section 2. In Section 3, we select high-redshift galaxies with the dropout selection technique. We obtain UV luminosity functions in Section 4, and discuss the properties of the faint galaxies in Section 5. Finally, we summarize our results in Section 6. Throughout this paper, we use a cosmology with Ω_m = 0.3, Ω_Λ = 0.7, Ω_b = 0.04, and H_0 = 70 km s^{−1} Mpc^{−1}.

2. DATA

For determination of UV luminosity functions, we use the complete samples of the HFF fields; Abell 2744, MACSJ0416, MACSJ0717, MACSJ1149, AbellS1063, and Abell370. Cluster and parallel fields of the six massive clusters have been observed with Advanced Camera for Surveys (ACS) and Wide Field Camera 3 (WFC3) of Hubble Space Telescope (HST) through 2013 October to 2016 September. The total survey area covers ∼ 56 arcmin^2. Drizzled and weight images are produced and released by the Space Telescope Science Institute (STScI) at the HFF Web site.^6 The images consist of three ACS bands and four WFC3-IR bands; F435W (B_{435}), F606W (V_{606}), F814W (i_{814}), F105W (Y_{105}), F125W (J_{125}), F140W (JH_{140}), and F160W (H_{160}).

First, we homogenize the Point Spread Function (PSF) of the WFC3 images. The PSF FWHM of homoginized images is ∼ 0.18 arcsec. We then measure the limiting magnitudes. We divide each image into 4 × 4 grid cells and define the limiting magnitude in each cell. This is because limiting magnitudes are not homogeneous due to the intra cluster light. The 5σ limiting magnitudes in the H_{160} band images are ∼ 28.5−29 mag in a 0.^{′′}35-diameter circular aperture. Details of the PSF homogenization procedure and the limiting magnitude measurements are described in Kawamata et al. (2016) (see also Ishigaki et al. 2015). A summary of the observational properties is provided in Tables 1 and 2.

3. SAMPLES

In this study, we select i-dropout (z ∼ 6 − 7), Y - dropout (z ∼ 8), Y J-dropout (z ∼ 9), and J-dropout (z ∼ 10) galaxy candidates. A detailed description of the dropout selections is given by Kawamata et al. (2016). In this section, we give a brief description about dropout selections. First, we create detection images using SWarp (Bertin et al. 2002). The dection images are combination of J_{125}, JH_{140}, and H_{160} bands for the i- and Y -dropout selections, JH_{140} and H_{160} bands for the Y J-dropout selection, and H_{160} band for the J-dropout selection, respectively. We run SExtractor (version 2.8.6; Bertin & Arnouts 1996) in dual-image mode using the detection images, and create photometric catalogs. The colors of galaxies are measured with MAG APER m_{AP}. The total

6 http://www.stsci.edu/hst/campaigns/frontier-fields/

magnitudes of galaxies m_{tot} are defined with the equation m_{tot} = m_{AP} − 0.82, where the offset 0.82 corresponds to the aperture correction and was derived in Ishigaki et al. (2015). Selection criteria of i-dropout galaxies are

i_{814} − Y_{105} > 0.8, (1) Y_{105} − J_{125} < 0.8, (2) i_{814} − Y_{105} > 2(Y_{105} − J_{125}) + 0.6, (3)

which are used in Atek et al. (2015b). We require the detection significance levels beyond 5σ level in the Y_{105} band and J_{125} band. We exclude the objects that are detected at the 2σ level in both the B_{435} and V_{606} bands or in the B_{435} + V_{606} stacked images.

For Y -dropouts, we adopt the selection criteria given by Atek et al. (2014):

Y_{105} − J_{125} > 0.5, (4) J_{125} − JH_{140} < 0.5, (5) Y_{105} − J_{125} > 1.6(J_{125} − JH_{140}) + 0.4. (6)

Similarly, we apply the source detection thresholds of the > 5σ significance levels in the J_{125}, JH_{140}, and H_{160} bands. We remove the objects that are detected at the 2σ level in at least one of the B_{435}, V_{606}, or i_{814} bands.

For Y J-dropouts, we use criteria presented in Oesch et al. (2013) and Ishigaki et al. (2015):

(Y_{105} + J_{125})/2 − JH_{140} > 0.75, (7) (Y_{105} + J_{125})/2 − JH_{140} >

0.8(JH_{140} − H_{160}) + 0.75, (8) J_{125} − H_{160} < 1.15, (9) JH_{140} − H_{160} < 0.6. (10)

We require the detection significance levels beyond 3σ level in both the JH_{140} and H_{160} bands and 3.5σ level in one of the JH_{140} or H_{160} bands. Again, we remove the objects that are detected at the 2σ level in the B_{435}, V_{606}, or i_{814} bands.

For J-dropouts, we apply the criteria used in Oesch et al. (2015):

J_{125} − H_{160} > 1.2, (11) S/N(B_{435} to Y_{105}) < 2. (12)

We also require χ^2_{opt+Y} < 2.5, where χ^2_{opt+Y} is defined by χ^2_{opt+Y} ≡ ∑ n SGN(f_n)S/N(n)^2. f_n is the nth band flux in B_{435}, V_{606}, i_{814}, and Y_{105}. SGN(f_n) is a sign function. S/Ns in the JH_{140} and H_{160} bands are required to be > 3.5σ in both bands and > 5σ in one of the two bands. Finally, spurious sources are removed from the dropout galaxy candidates by visual inspection.

In this study, we find no J-dropout candidates in the all cluster and parallel fields. Our dropout samples consist of 350 i-dropouts, 66 Y -dropouts, and 40 Y J-dropouts in total. The number of the dropout candidates in each field is listed in Table 1. We list these dropout candidates in Tables 4, 5, and 6. The values of magnitudes are slightly different from those in Kawamata et al. (2016) because Kawamata et al. (2016) used an older version of SExtractor.

4. UV LUMINOSITY FUNCTIONS

Full-Data Results of Hubble Frontier Fields 3

Table 1 Observational properties and the numbers of high-z galaxy candidates of the HFF Data

Field Depth (H_{160} )^a Area^b Number of Galaxies (5σ limit mag) (arcmin^2 ) z ∼ 6 − 7 z ∼ 8 z ∼ 9 z ∼ 10

Abell2744 Cluster 28.88 4.75 (1.52^c) 22 10 3 0 Abell2744 Parallel 29.11 4.32 30 4 4 0 MACS0416 Cluster 28.84 4.73 (2.00^c) 25 5 3 0 MACS0416 Parallel 29.30 4.78 23 9 6 0 MACS0717 Cluster 28.56 4.58 (0.75^c) 22 0 0 0 MACS0717 Parallel 28.88 4.25 41 6 3 0 MACS1149 Cluster 28.87 4.66 (1.32^c) 41 2 4 0 MACS1149 Parallel 29.04 4.72 37 10 3 0 AbellS1063 Cluster 28.85 4.25 (0.98^c) 23 4 2 0 AbellS1063 Parallel 29.12 4.36 39 6 3 0 Abell370 Cluster 28.65 4.14 (0.73^c) 7 6 2 0 Abell370 Parallel 29.14 4.31 40 3 7 0 Total 350 66 40 0

a The depths are defined with a 0.^{′′}35-diameter aperture. b The area of each image is reduced by the masking near the bright stars. c The survey area in the source plane at z = 7.

Table 2 5σ limiting magnitudes

Field B_{435} V_{606} i_{814} Y_{105} J_{125} JH_{140} H_{160}

Abell2744 Cluster 28.72 28.83 28.94 29.20 28.87 28.92 28.88 Abell2744 Parallel 28.84 29.20 29.03 29.39 29.00 29.03 29.11 MACS0416 Cluster 28.74 29.08 28.96 29.11 28.85 28.87 28.84 MACS0416 Parallel 28.65 28.92 29.01 29.45 29.22 29.26 29.30 MACS0717 Cluster 28.70 28.74 28.76 28.91 28.61 28.70 28.56 MACS0717 Parallel 28.96 29.00 29.01 29.16 28.94 28.95 28.88 MACS1149 Cluster 28.57 28.89 28.94 29.17 28.81 28.73 28.87 MACS1149 Parallel 28.50 28.83 28.90 29.35 28.98 29.06 29.04 AbellS1063 Cluster 28.69 28.86 28.90 29.19 28.87 28.98 28.85 AbellS1063 Parallel 28.87 29.66 29.09 29.43 29.06 29.19 29.12 Abell370 Cluster 28.64 28.78 28.86 29.00 28.69 28.74 28.65 Abell370 Parallel 28.65 28.90 29.07 29.45 29.00 29.01 29.14

In this section, we calculate UV luminosity functions at z ∼ 6 − 7, 8, 9, and 10. UV luminosity functions are represented by the Schechter function with three parameters; ϕ_∗, M_∗, and α:

Φ(M_{UV}, ϕ_∗, M_∗, α)dM_{UV} = 0.4ϕ_∗ ln(10)

× exp [ 10^{−0.4(MUV−M∗)} ] 10^{−0.4(α+1)(MUV−M∗)}dM_{UV}.

(13)

We derive the luminosity functions basically in the same manner as that described in Section 5 of Ishigaki et al. (2015), that adopt the luminosity function fitting on the image plane. We refer to the method as the image plane method in the remainder of this paper. The image plane method deals with not only the lensing magnification effects, but also the distortion and multiplication of lensed images in a self-consistent way. Oesch et al. (2015) showed that the detection completeness of galaxies strongly depends on the galaxy size and the image distortion, especially at areas with high magnifications. It is critical to properly evaluate the lensing effects and the properties of high-redshift galaxies to derive the luminosity functions, as done in this paper. In this study, we define M_{UV} as the magnitude in the rest-frame wavelength of 1500Å. This wavelength roughly corresponds to J_{125}, JH_{140}, H_{160}, and H_{160} bands at z ∼ 6 − 7, 8, 9, and 10, respectively.

In section 4.1, we create mock catalogs of high-redshift galaxies and obtain number densities on the image plane. In section 4.2, we compare number densities of the mock catalogs with those of the observation, and determine the best fit Schechter parameters.

4.1. Creation of Mock Catalogs

We create mock catalogs of simulated high-redshift galaxies at z ∼ 5.0 − 12. The number densities of the galaxies follow the Schechter functions. The halflight radius of the galaxies are ∼ 0.45, ∼ 0.22, and ∼ 0.11 kpc for galaxies with magnitudes of M_{UV} < −20, −20 < M_{UV} < −16, and M_{UV} > −16, respectively. This assumption is consistent with the size–luminosity relations adopted in previous studies. The Sérsic index is assumed to be 1. The ellipticities are randomly chosen from the range of 0.0–0.9, because high-redshift galaxy studies show roughly uniform distributions of the ellipticities (e.g. Ravindranath et al. 2006). The UV spectral slope β is assumed to be β = −2, which is consistent with the result of Bouwens et al. (2014). The UV spectra are attenuated with the IGM absorption model of Madau et al. (1996). The mock galaxies are distributed in random positions of the source plane. We create images of the mock galaxies with writeimage function in the lens model software glafic (Oguri 2010). The writeimage function calculates the gravitational lensing effects including magnification, distortion, and multiplication, for an object and produce the image(s) in the image plane.

4 Ishigaki et al.

Here we use the mass models of the six clusters described in Kawamata et al. (2016) and Kawamata et al. (2017). Three out of the six models are released in the HFF Web site^7 as version 3 for Abell 2744, MACS0717, and MACS1149. We use an updated version of the mass model for MACS0416 (Kawamata et al. 2017). In the parallel fields, we use writeimage ori function, which creates unlensed images. We add the simulated images in the real HFF data. Then we detect the mock galaxies with SExtractor and select dropouts in the mock catalogs with the color criteria same as the observations described in Section 3. We obtain number densities of dropouts in the mock catalogs.

Low-redshift galaxies are potentially contaminate the dropout catalogs of the observational data. We estimate the contamination rate by the following procedure. First, we create the catalogs of bright (22 < H_{160} < 25) objects in the HFF images. In this magnitude range, all objects do not meet the color criteria of the dropouts, which are probably low-redshift interlopers. Then we create interloper catalogs of faint objects (25 < H_{160} < 29). We fit the number densities of the bright interlopers with a power-law function, and match the number densities of the faint interlopers to those extrapolated from the bright magnitudes. We assume that the physical properties of faint interlopers such as the color and size are the same as those of the bright objects. We create images of artificial objects from these catalogs with the mkobjects package of iraf, and randomly place them on the HFF images. We detect the artificial objects with SExtractor, and select the artificial objects that meet the dropout selection criteria. We regard these selected objects as contaminants. We thus obtain the contamination rate of dropouts as a function of magnitude. The contamination rate is ∼ 9% (∼ 32%) in the magnitude range of M_{UV} < 27.25 (M_{UV} > 27.25) on average. We add the number densities of the contaminants to the total number densities of the dropouts in the mock catalogs.

4.2. Luminosity Function Fitting

We compare the observed number densities of dropouts with the number density obtained in the simulations, which is described in the Section 4.1. We obtain the best-fit luminosity function by fitting these number densities with a maximum likelihood method. We calculate the likelihood with the following equation, assuming the Poisson errors: L ∝ ∏ field ∏ i n^{nobs,i}_{sim,i} e^{−nsim,i} , (14)

where n_{sim,i} is the simulated number counts in an ith magnitude bin, and n_{obs,i} is the observed number counts in the HFF in the magnitude bin. We treat the three Schechter parameters, ϕ_∗, M_∗, and α, as free parameters in the fitting of luminosity functions at z ∼ 6 − 7 and 8. The number counts at z ∼ 9 and z ∼ 10 have too poor statistcis to constrain the three Schechter parameters. Therefore, we also provide results where we treat ϕ_∗ as the only free parameter at z ∼ 9 and 10, and fix M_∗ and α to the values at z ∼ 8, −20.35 and −1.96, respectively. In order to improve the statistics, we simultaneously fit our number counts data and UV luminosity

7 https://archive.stsci.edu/prepds/frontier/lensmodels/

function data points from previous studies. We use recent results of blank field surveys; Bouwens et al. (2015); Bowler et al. (2014); Ouchi et al. (2009); Bradley et al. (2012); Oesch et al. (2013); Calvi et al. (2016). Although Schmidt et al. (2014) presented an updated result of the BoRG survey (Bradley et al. 2012), we do not incorporate their result because they do not provide number densities at individual magnitudes. We iterate the luminosity function fitting with various Schechter parameter sets, and obtain the best-fit parameters.

One of the advantages of the image plane method is that the result is not affected by uncertainties of magnification factors of dropout candidates. If a galaxy has magnification factor larger than ∼ 100, the 1σ error of the magnification is as large as itself (Tables 10 to 12 in Kawamata et al. 2016). Luminosity function fitting on the source plane has large uncertainty in the faint end, because the galaxy samples in the faint magnitude bins consists of galaxies with high magnification factors. The disadvantage of the image plane method is that there is a degeneracy between number densities of intrinsically bright and faint galaxies with the same apparent magnitude. The constraints on the faint end of luminosity functions are weaker than those with fitting on the source plane. In order to strengthen the constraints on the faint end, we divide the dropout samples into subsamples with magnification factor binning of μ < 2, 2 < μ < 6, 6 < μ < 18, and μ > 18 at z ∼ 6 − 7. We use the surface number density in each magnitude bin and in each magnification factor bin for fitting. Note that the number densities divided with magnification factor bins depend on mass models, although the uncertainty is not larger than the one in fitting on the source plane. We estimate the uncertainty of mass models in the end of this section. At z ≳ 8, we do not divide the samples, because the number of z ≳ 8 galaxy candidates is not large enough for making subsamples.

The best-fit parameters are shown in Table 3. We find that the uncertainties in M_∗ and ϕ_∗ are considerably large due to a degeneracy between the two parameters when all parameters are variable. Plotted in Figure 1 is the faint-end slope α as a function of redshift. Our results indicate that the best-fit values of α are about −2 at z ∼ 6 − 7 to 10, which are steeper than those at lower redshift (e.g. α ∼ −1.6 at z ∼ 4 in Bouwens et al. 2015). We show the fitting results at z ∼ 6 − 7, 8, 9, and 10 in Figures 2, 3, 4, and 5, respectively. The top and bottom panel present the observed number densities and the best-fit luminosity functions in the image plane and the source plane, respectively. We also plot the results of previous blank-field surveys (Bouwens et al. 2015; Bowler et al. 2014; Ouchi et al. 2009; Schenker et al. 2013; Bradley et al. 2012; Finkelstein et al. 2015; McLure et al. 2013; Oesch et al. 2013; Calvi et al. 2016) and recent HFF results in other studies (Laporte et al. 2016; Atek et al. 2015a; McLeod et al. 2016). The best-fit parameters are consistent with those in previous studies. In the top panel of Figure 2, there may be an excess in the observed surface number density at J_{125} = 28.5. The reason for this excess is not clear, although using a size–luminosity relation which gives smaller sizes at faint magnitudes may reduce this excess. At z ∼ 8, the observed number densities at the bright end are slightly larger than the number densities in the simulation. It is

Full-Data Results of Hubble Frontier Fields 5

probably due to the existence of an overdense region of z ∼ 8 dropouts in the Abell 2744 cluster field. We discussed the properties of the overdensity in Ishigaki et al. (2016) (see also Atek et al. 2015b and Zheng et al. 2014). At z ∼ 10, although we detect no galaxies, we can place a constraint on the luminosity function from the nondetection. Based on the best-fit parameters where only ϕ_∗ is variable, ∼ 1.4 galaxies are expected to be detected in the HFF fields. The middle panels of Figures 2–5 show histograms of the number of the dropouts. It is seen that our samples push the magnitude limits of the luminosity functions significantly by up to ∼ 3 magnitude.

Bouwens et al. (2017b) claim that the accuracy of UV luminosity functions is limited due to the uncertainty of mass models. In order to estimate the uncertainty of mass models with the method we use for the luminosity function at z ∼ 6 − 7, we check the magnification factors of the dropout candidates with five different mass models from Bradac (v2 for Abell 2744, v3 for MACS0416, and v1 for MACS0717, MACS1149, AbellS1063, and Abell370; Wang et al. 2015, Hoag et al. 2016, see also Bradač et al. 2009), CATS (v3.1 for Abell 2744, v3.1 for MACS0416, v1 for MACS0717, MACS1149, AbellS1063, and Abell370; Jauzac et al. 2015), Sharon (v3 for Abell 2744 and MACS0416, v2 for MACS0717, v2.1 for MACS1149, v1 for Abell370 and AbellS1063; Johnson et al. 2014), Williams (v3 for Abell 2744, v3.1 for MACS0416, v1 for MACS0717, MACS1149, AbellS1063, and Abell370), and Zitrin (LTM v1 for all the six clusters; Zitrin et al. 2009, Zitrin et al. 2013). We obtain the UV luminosity functions at z ∼ 6 − 7 with these five different mass models. Figure 7 shows the best-fit Schechter parameters and the 68% and 95% confidence levels. We confirm that the difference of the best-fit parameters are Δϕ_∗ ∼ 0.2, ΔM_∗ ∼ 0.2, and Δα ∼ 0.1, which are comparable to the statistical errors of these parameters (Table 3). Magnification factor of each dropout could be different from others in different mass model (see also Figure 11 of Ishigaki et al. 2015), but the values of the best-fit Schechter parameters are almost the same in all the mass models.

5. DISCUSSION

In the previous section, we derive the UV luminosity functions at z ∼ 6 − 10 from the HFF data and the previous blank field data. In this section, we estimate the UV luminosity densities ρ_{UV} from the luminosity functions which constrain the physical properties of ionizing sources and reionization.

5.1. Evolution of the UV Luminosity Density

The value of ρ_{UV} is calculated with the following equation:

ρ_{UV}(z) =

∫_{Mtrunc} −∞ Φ(M)L(M)dM, (15) where L(M) is the UV luminosity corresponding to the UV magnitude M. The value of M_{trunc} is the truncation magnitude of the UV luminosity function, i.e., there are no galaxies with the magnitudes fainter than M_{trunc}. We calculate ρ_{UV} at z ∼ 6 − 7, 8, 9, and 10 using the bestfit Schechter functions obtained in Section 4.2. Figure 8 shows ρ_{UV} calculated from Equation (15) with M_{trunc} =

Figure 1. Redshift evolution of the faint-end slope α of the restframe UV luminosity function. The red circles show our results and the black symbols show the values of local UV-selected galaxies (Treyer et al. 1998), 0.2 ≤ z ≤ 1.2 galaxies (Arnouts et al. 2005), 1.9 ≤ z ≤ 3.4 LBGs (Reddy & Steidel 2009), z ∼ 8 LBGs (Bradley et al. 2012), z ∼ 6 LBGs (Atek et al. 2015a), z ∼ 4 − 8 LBGs (Bouwens et al. 2015), z ∼ 7 − 9 LBGs (Laporte et al. 2016), z ∼ 7 − 8 LBGs (Livermore et al. 2017), and z ∼ 6 − 9 LBGs (Kawamata et al. 2017).

−15.0 and M_{trunc} = −17.0. The right axis in Figure 8 presents cosmic star formation rate densities (SFRDs) from a given luminosity density that are estimated from ρ_{UV} based on Equation (2) of Madau et al. (1998).

For comparisons, we also show the data plots of ρ_{UV} with M_{trunc} = −15.0 and M_{trunc} = −17.0 at z ∼ 4 − 12 that are taken from previous studies (Bouwens et al. 2015; McLeod et al. 2016; Coe et al. 2013; Ellis et al. 2013). In Figure 8, we include total ρ_{UV} at z ∼ 0 − 3 (Steidel et al. 1999; Wyder et al. 2005; Schiminovich et al. 2005; Reddy & Steidel 2009), and cosmic SFRDs at z ∼ 1 − 4 based on ρ_{UV} (M_{trunc} = −15.0) and IR luminosity densities (the sensitivity corresponding to ≃ 30 μJy) (Dunlop et al. 2017). Our results are consistent with these previous studies at z ∼ 6 − 10.

Our results support a non-accelerated decline of ρ_{UV} toward high redshifts in the case of M_{trunc} = −15.0 (see also McLeod et al. 2016). We check whether we can approximate the evolution of log ρ_{UV} from z = 4 to 10 as a linear function. We fit the log ρ_{UV} from this work and Bouwens et al. (2015) with linear and quadratic functions. The Akaike Information Criterion corrected for small data sets (AICc; Sugiura 1978) for the linear function is smaller by ΔAICc = 3.69 than that for the quadratic function, suggesting a non-accelerated ρ_{UV} evolution.

However, we find an accelerated decline when a brighter truncation magnitude of M_{trunc} = −17.0 is adopted, which is closer to M_{trunc} = −17.7 adopted in Oesch et al. (2013), who support an accelerated decline. In Figure 8, we present fitting results to ρ_{UV} in this work and Bouwens et al. (2015) with a linear function at z ∼ 4 − 8 and its extrapolation toward z ∼ 10. This indicates the trends of non-accelerated and accelerated declines in the cases of M_{trunc} = −15.0 and −17.0, respectively. One possible explanation for this dependence on M_{trunc} is the evolution of the faint-end slope toward steeper value at higher redshifts (see Figure 1).

6 Ishigaki et al.

Table 3 Best-fit Schechter parameters of luminosity functions

Reference M_∗ log ϕ_∗ [Mpc^{−3}] α z ∼ 6 − 7 This Work −20.89^{+0.17}_{−0.13} −3.78^{+0.15}_{−0.15} −2.15^{+0.08}_{−0.06} Atek et al. (2015a) −20.89^{+0.60}_{−0.72} −3.54^{+0.48}_{−0.45} −2.04^{+0.17}_{−0.13} Bouwens et al. (2015) −20.87 ± 0.26 −3.53^{+0.24}_{−0.23} −2.06 ± 0.13 Laporte et al. (2016) −20.33^{+0.37}_{−0.47} −3.43^{+0.12}_{−0.15} −1.91^{+0.26}_{−0.27} Livermore et al. (2017) −20.800^{+0.058}_{−0.049} −3.667^{+0.044}_{−0.041} −2.07^{+0.04}_{−0.04} Kawamata et al. (2017) −20.73^{+0.46}_{−0.81} — −1.86^{+0.17}_{−0.18} z ∼ 8 This Work −20.35^{+0.20}_{−0.30} −3.60^{+0.15}_{−0.30} −1.96^{+0.18}_{−0.15} Bradley et al. (2012) −20.26^{+0.29}_{−0.34} −3.37^{+0.26}_{−0.29} −1.98^{+0.23}_{−0.22} Bouwens et al. (2015) −20.63 ± 0.36 −3.68 ± 0.32 −2.02 ± 0.23 Laporte et al. (2016) −20.32^{+0.49}_{−0.26} −3.52^{+0.58}_{−0.44} −1.95^{+0.43}_{−0.40} Livermore et al. (2017) −20.742^{+0.195}_{−0.152} −3.784^{+0.145}_{−0.145} −2.02^{+0.08}_{−0.07} Kawamata et al. (2017) −20.73 (fixed) — −1.80^{+0.22}_{−0.30} z ∼ 9 This Work −51.39^{+18.51}_{−44.73} −19.42^{+7.73}_{−24.15} −2.22^{+0.26}_{−0.17} This Work −20.35 (fixed) −3.88^{+0.08}_{−0.12} −1.96 (fixed) Oesch et al. (2013) −18.8 ± 0.3 −2.94 (fixed) −1.73 (fixed) Laporte et al. (2016) −20.45 (fixed) −4.15^{+0.15}_{−0.24} −2.17^{+0.41}_{−0.43} McLeod et al. (2016) −20.1 (fixed) −3.62^{+0.08}_{−0.10} −2.02 (fixed) Kawamata et al. (2017) −20.73 (fixed) — −1.59^{+0.19}_{−0.18} z ∼ 10 This Work −59.71^{+29.90}_{−9.61} −35.60^{+23.73}_{−5.93} −2.93^{+0.83}_{−0.41} This Work −20.35 (fixed) −4.60^{+0.14}_{−0.22} −1.96 (fixed) Oesch et al. (2014) −20.12 (fixed) −4.27 ± 0.21 −2.02 (fixed Bouwens et al. (2015) −20.92 (fixed) −5.10^{+0.18}_{−0.20} −2.27 (fixed) McLeod et al. (2016) −20.1 (fixed) −3.90^{+0.13}_{−0.20} −2.02 (fixed)

The faint-end slope steepening makes the ρ_{UV} difference (between the cases of M_{trunc} = −15.0 and −17.0) larger at z ∼ 10 than at z ∼ 8. The redshift evolution of M_∗ toward fainter magnitudes (see Figure 6) would also contribute to this larger increases of ρ_{UV} at higher redshifts.

On the other hand, our previous study in Ishigaki et al. (2015) has claimed that ρ_{UV} shows an accelerated decrease beyond z ∼ 8. This can be because they adopt a brighter truncation magnitude of M_{trunc} = −17.0. Another possible explanation for the difference is cosmic variance. Ishigaki et al. (2015) only use the data of Abell 2744 cluster and parallel fields. In these fields, the galaxy density at z ∼ 8 is ∼ 0.1 dex higher than the average of total fields (Ishigaki et al. 2016), and the one at z ∼ 9 is ∼ 0.1 dex lower than the average.

5.2. Preperties of the Ionizing Sources In this section, we calculate the ionized hydrogen fraction Q_{HII} and the Thomson scattering optical depth τ_e, basically in the same manner as that described in Section 5 of Ishigaki et al. (2015).

The value of Q_{HII} is calculated with the following equation (e.g. Robertson et al. 2013):

Q̇_{HII} = ṅ^{ion} ⟨n_H⟩ − Q_{HII} t_{rec}

. (16)

In the first term of Equation (16), ṅ_{ion} and ⟨n_H⟩ denote the production rate of ionizing photons and the mean hydrogen number density, respectively. ṅ_{ion} and ⟨n_H⟩ are defined by the following equations:

ṅ_{ion} =

∫_{Mtrunc} −∞ f_{esc}(M_{UV})ξ_{ion}(M_{UV})Φ(M_{UV})L(M_{UV})dM_{UV}

≡ ⟨f_{esc}ξ_{ion}⟩ ρ_{UV}, (17)

⟨n_H⟩ =

X_pΩ_bρ_c m_H

, (18)

where X_p is the primordial mass fraction of hydrogen, ρ_c is the critical density, and m_H is the mass of the hydrogen atom. f_{esc} is the fraction of the number of escaping ionizing photons to those produced in a galaxy. ξ_{ion} is the numerical factor that converts a UV luminosity density to the ionizing photon emission rate of a star-forming galaxy. Note that f_{esc} and ξ_{ion} appear in the product form in Equation (17). Here we assume that f_{esc} and ξ_{ion} do not depend on M_{UV}. We present the magnitudeaveraged value of the product of f_{esc} and ξ_{ion} as ⟨f_{esc}ξ_{ion}⟩. In the second term of Equation (16), t_{rec} represents the averaged gas recombination time:

t_{rec} = 1 C_{HII} α_B(T )(1 + Y_p/4X_p)⟨n_H⟩(1 + z)^3

, (19)

where α_B is the case-B hydrogen recombination coefficient, T is the IGM temperature, and Y_p is the primordial helium mass fraction. C_{HII} ≡ ⟨ n^2_{HII} ⟩ / ⟨n_{HII} ⟩^2 is a clumping factor, where n_{HII} is the local number density

Full-Data Results of Hubble Frontier Fields 7

Figure 2. Surface number densities, histograms of number counts, and luminosity functions of z ∼ 6 − 7 dropout candidates. Top panel: surface number densities of our dropout candidates in the HFF data (circles) and those derived from the best-fit Schechter function (lines). The colors of the circles and lines denote the magnification factor of 0 < μ < 2 (red), 2 < μ < 6 (orange), 6 < μ < 18 (yellow), and 18 < μ (green). The horizontal axis shows the apparent magnitude in the J_{125} band. Middle panel: histograms of the number counts of dropouts in our study (red) and previous studies: Ouchi et al. (2009) (green), Bowler et al. (2014) (yellow), and Bouwens et al. (2015) (blue). Bottom panel: bestfit Schechter function (black line) with the 1σ error (gray region) and the luminosity functions derived by this work (red circles), Bouwens et al. (2014) (blue circles), Bowler et al. (2014) (yellow circles), Ouchi et al. (2009) (green circles), Finkelstein et al. (2015) (open up-triangles), Laporte et al. (2016) (open down-triangles), Schenker et al. (2013) (open squares), Atek et al. (2015a) (crosses), and Livermore et al. (2017) (open diamonds). The horizontal axis presents the absolute magnitude in the J_{125} band.

of ionized hydrogen. In this work, we use the following equation:

C_{HII} = 2.9 × [ (1 + z) 6 ]_{−1.1} , (20)

which was obtained from the hydrodynamical + N-body simualtions in Shull et al. (2012). The value of the clumping factor is not accurately known observationally, although many theoretical studies suggest similar values of clumping factor, C_{HII} ∼ 1 − 6, in the epoch of reionization (Sokasian et al. 2003; Iliev et al. 2006; Finlator et al. 2012).

Figure 3. Same as Figure 2, but for z ∼ 8. The horizontal axes in the top and bottom panels present the apparent and intrinsic magnitudes in the JH_{140} band, respectively. The results of Bradley et al. (2012) are shown with the green histogram (moddle panel) and circles (bottom panel). In the bottom panel, we also plot the result of Livermore et al. (2017) with the open diamonds.

The value of τ_e is calculated with the following equation (Kuhlen & Faucher-Giguère 2012):

τ_e(z) = ∫_z 0 c(1 + z^′)^2 H(z^′) Q_{HII} σ_T⟨n_H⟩

×(1 + ηY_p/4X_p)dz^′,

(21)

where H(z) is the Hubble parameter, σ_T is the Thomson scattering cross section, and c is the speed of light. We assume that helium is singly ionized (corresponding to η = 1) at z > 4 and doubly ionized (corresponding to η = 2) at z ≤ 4, following Kuhlen & Faucher-Giguère (2012). Recently, Planck Collaboration et al. (2016) have obtained τ_e = 0.058±0.012 from the measurement of T T power spectrum and EE polarization of CMB. The value of τ_e from Planck Collaboration et al. (2016) is smaller than the one obtained in previous observations by nineyear WMAP (τ_e = 0.088 ± 0.013, Bennett et al. 2013; Hinshaw et al. 2013) and Planck 2014 (τ_e = 0.092±0.013, Planck Collaboration et al. 2014).

We assume the following two functional form of ρ_{UV}. One is the four-parameter function from Madau & Dick-

8 Ishigaki et al.

Figure 4. Same as Figure 2, but for z ∼ 9. The horizontal axes in the top and bottom panels present the apparent and intrinsic magnitudes in the H_{160} band, respectively. The blue (green) histogram and circles denote the results of Oesch et al. (2013) (Calvi et al. 2016), respectively. In the bottom panel, we also plot the results of McLure et al. (2013) (open squares), McLeod et al. (2015, 2016) (crosses), and Bouwens et al. (2016b) (open triangles).

inson (2014) (see also Robertson et al. 2015):

ρ_{UV}(z) = a_p

(1 + z)^b_p

1 + [(1 + z)/c_p]^d_p

, (22)

which has free parameters of a_p, b_p, c_p, and d_p. The other is a logarithmic double power law function used in Ishigaki et al. (2015):

ρ_{UV}(z) =

2ρ^∗_{UV} 10^{a(z−z∗)} + 10^{b(z−z∗)} , (23)

which also has four free parameters; ρ^∗_{UV}, z_∗, a, and b. We perform χ^2 fitting to the observational data of ρ_{UV}, Q_{HII}, and τ_e. In each parameter space, we adopt one of the two functional forms of ρ_{UV}(z) whose minimum χ^2 is smaller than the one of the other. We use the ρ_{UV} data points at z ∼ 6 − 7, 8, 9, and 10 (this work) and z ∼ 4, 5, and 6 (Bouwens et al. 2015) that are presented in the left panel of Figure 9. Although ρ_{UV} at z ∼ 10 scatters upward due to the large uncertainty in α, this does not significantly affect the fitting

Figure 5. Same as Figure 2, but for z ∼ 10. The horizontal axes in the top and bottom panels present the apparent and intrinsic magnitudes in the H_{160} band, respectively. The blue (green) circles denote the results of Oesch et al. (2014) (Calvi et al. 2016), respectively. In the bottom panel, we also plot the results of Bernard et al. (2016) (open down-triangles), McLeod et al. (2016) (crosses), and Bouwens et al. (2015) (open up-triangles).

Figure 6. Contours of Schechter parameters M_∗ and α indicating the 68% and 95% confidence levels. In this plot, blue (magenta) symbols an lines denote z ∼ 6 − 7 (z ∼ 8). The values of the bestfit Schechter parameters are shown with the cross symbols. We plot the best-fit parameters from previous studies: Ishigaki et al. (2015) (circles), Atek et al. (2015a) (square), Bouwens et al. (2015) (down-triangles), Ouchi et al. (2009) (up-triangle), Schenker et al. (2013) (pentagons), Livermore et al. (2017) (diamonds), Bradley et al. (2012) (star), and Kawamata et al. (2017) (hexagon).

result because of its large uncertainty. We also use the Q_{HII} data plotted in the right panel of Figure 9 from Bolton et al. (2011); Carilli et al. (2010); Chornock et al. (2013, 2014); Dijkstra et al. (2011); Konno et al. (2014); McGreer et al. (2011); McQuinn et al. (2007, 2008); Mesinger & Furlanetto (2008); Mesinger (2010); Ouchi et al. (2010); Ota et al. (2008); Patel et al. (2010); Totani

Full-Data Results of Hubble Frontier Fields 9

Figure 7. Contours of Schechter parameters M_∗ and α at z ∼ 6−7 with different mass models; GLAFIC (red), Bradac(magenta), CATS (yellow), Sharon (green), Williams (cyan), and Zitrin-LTM (blue). The values of the best-fit Schechter parameters are shown with the cross symbols.

et al. (2006, 2014). In addition to these observational constraints, we compare τ_e = 0.058 ± 0.012 (Planck Collaboration et al. 2016) with the value of τ_e at z = 30 calculted from Equation (21). There are six free parameters in the χ^2 fit, ⟨f_{esc}ξ_{ion}⟩, M_{trunc}, and the four parameters in the function of ρ_{UV}(z). The parameter range of ⟨f_{esc}ξ_{ion}⟩ is 0 to 10^{25.34} [erg^{−1} Hz], where we assume that 0 < f_{esc} < 1 and log ξ_{ion}/[erg^{−1} Hz] = 25.34 (Bouwens et al. 2016a). The parameter range of M_{trunc} is −16 to −10; M_{trunc} = −16 mag corresponds to the detection limit of current observations, and M_{trunc} = −10 mag is the magnitude of minimium halos which have star forming galaxies predicted by Faucher-Giguère et al. (2011).

We calculate the total χ^2 value by summing up the χ^2 of the data points of ρ_{UV}, Q_{HII}, and τ_e, and derive the best-fit parameters. The best-fit parameters are log a_p = 25.9, b_p = 3.7, c_p = 2.3, d_p = 5.5, ⟨log f_{esc}ξ_{ion}⟩ = 24.57 and M_{trunc} = −11.0, and the χ^2 is 9.28 for 12 degrees of freedom. Figure 9 shows the best-fit functions of ρ_{UV}, τ_e, and Q_{HII}. These best-fit functions agree well with the data points of the observations. This result is in contrast with the conclusion of our previous study of Ishigaki et al. (2015), which claim that no parameter set can reproduce both the ρ_{UV} evolution and the value of τ_e. The main reason for this difference is that Ishigaki et al. (2015) use the value τ_e = 0.091^{+0.013}_{−0.014} from Planck Collaboration et al. (2014), which is significantly larger than the latest result used in our study (τ_e = 0.058 ± 0.012; Planck Collaboration et al. 2016). Another reason is that this study supports a non-accelerated decline of ρ_{UV} toward high redshift as explained in Section 5.1. In this study, the small value of τ_e and a non-accelerated decline of ρ_{UV} alleviate the tension between τ_e and ρ_{UV} claimed by Ishigaki et al. (2015).

Figure 10 presents the 68% and 95% confidence intervals on the ⟨f_{esc}ξ_{ion}⟩–M_{trunc} plane with megenta contours. The best-fit value and the 68% interval are ⟨log f_{esc}ξ_{ion}⟩ = 24.57^{+0.15}_{−0.08} and M_{trunc} > −14.0. If we assume log ξ_{ion}/[erg^{−1} Hz] = 25.34 obtained in Bouwens et al. (2016a), we place upper and lower limits on the

Figure 8. UV luminosity densities ρ_{UV} calculated with M_{trunc} = −15 (top) and M_{trunc} = −17 (bottom). We show ρ_{UV} taken from this work (red circles), Bouwens et al. (2015) (black filled circles), McLeod et al. (2016) (black filled squares), Coe et al. (2013) (black filled down-triangles), and Ellis et al. (2013) (black filled up-triangle). We also plot total ρ_{UV} from Steidel et al. (1999) (open hexagon), Wyder et al. (2005) (open diamond), Schiminovich et al. (2005) (open squares), and Reddy & Steidel (2009) (open circles). The orange circles denote the cosmic SFRDs derived with ρ_{UV} and IR luminosity densities (Dunlop et al. 2017). The gray solid and dashed lines show a linear fitting to samples in this work and Bouwens et al. (2015) at z ∼ 4 − 8 and its extrapolation to z ∼ 8 − 10, respectively.

escape fraction, f_{esc} < 0.24 and f_{esc} > 0.14, respectively. These constraints of f_{esc} and M_{trunc} are mainly driven by the observational constraints of Q_{HII}. We also derive the length of the reionization period Δz that is defined by the period bracketed by two redshifts whose Q_{HII} values are 0.1 and 0.99. Figure 10 shows the contours of Δz predicted by our χ^2 fitting results. The contours suggest Δz = 3.9^{+2.0}_{−1.6} in the 68% confidence interval on the ⟨f_{esc}ξ_{ion}⟩–M_{trunc} plane. Planck Collaboration et al. (2016) obtain Δz < 2.8 from kSZ constraints and a reionization model, which is indicative of the relatively sharp reionization history. The blue shade in Figure 10 presents the 68% confidence interval constrained from the result of Planck Collaboration et al. (2016) on the ⟨f_{esc}ξ_{ion}⟩– M_{trunc} plane. Our constraints on Δz are complimentary to those of Planck Collaboration et al. (2016), giving

10 Ishigaki et al.

both the upper and lower limit of Δz. The combination of the constraints from our and Planck Collaboration et al. (2016) studies suggest Δz ∼ 2 − 3, which suggests the moderately sharp reionization history.

6. SUMMARY In this study, we have produced catalogs of dropout galaxies at z ∼ 6 − 10 using the all cluster and parallel fields data taken by the HFF program. Using our new mass models, we have conducted Monte-Carlo simulations, and estimated the number densities of dropout galaxies at z ∼ 6 − 10. We then derive the UV luminosity densities and discuss the properties of ionizing sources and reionization. The results in this study are summarized below:

1. With the dropout selection technique, we identify ∼ 400 star-forming galaxies over the redshift range z ∼ 6 − 10, which include 350 i-dropout, 66 Y - dropout, and 40 Y J-dropout candidates. We do not find J-dropout candiates in the HFF data. The number of dropout candidates in our catalogs is six times larger than the one obtained in our previous study (Ishigaki et al. 2015) that use one set of the cluster and parallel field data.

2. The faint end slope of UV luminosity functions has a very steep value α ∼ −2. The UV luminosity densities calculated from the UV luminosity functions are consistent with those in previous studies. Our results support the evolutionary trend of a nonaccelerated decline in the UV luminosity densities beyond z ∼ 8 in the case of M_{trunc} = −15, consistent with the conclusions of McLeod et al. (2016), while an accelerated decline in the case of a brighter truncation magnitude of M_{trunc} = −17, consistent with the conclusions of Oesch et al. (2013); Bouwens et al. (2015); Ishigaki et al. (2015); Oesch et al. (2015).

3. Using the standard analytical reionization model, we calculate the physical parameters related to reionization, such as the Thomson scattering optical depth τ_e and the ionized hydrogen fraction Q_{HII}. The values of τ_e and Q_{HII} are consistent with the latest result of Planck Collaboration et al. (2016) (τ_e = 0.0058 ± 0.0012) and previous studies of Q_{HII} obtained with Lyα absorptions found in QSOs, GRBs, and galaxies. We obtain the constraints on the parameters of ionizing sources. The best-fit value and the 68% confidence intervals of the averaged value of the escape fraction and truncation magnitude are f_{esc} = 0.17^{+0.07}_{−0.03} and M_{trunc} > −14.0, respectively, under the assumption of log ξ_{ion}/[erg^{−1} Hz] = 25.34. The results suggest that the length of the reionization period is Δz = 3.9^{+2.0}_{−1.6} which is consistent with the Δz estimate from the kinetic Sunyaev-Zeldovich effect in Planck Collaboration et al. (2016).

We are grateful to Akio Inoue, Masayuki Umemura, Masanori Iye, Kentaro Nagamine, Takatoshi Shibuya for useful comments and discussions. This research was supported by the Munich Institute for Astro- and Particle

Physics (MIAPP) of the DFG cluster of excellence ”Origin and Structure of the Universe”. This work is supported by World Premier International Research Center Initiative (WPI Initiative), MEXT, Japan, and KAK- ENHI (JP15H02064, JP26800093, and JP15H05892) Grant-in-Aid for Scientific Research (A) through Japan Society for the Promotion of Science (JSPS). M.I. acknowledges support by Grant-in-Aid for JSPS Research Fellow (JP16J03727) and an Advanced Leading Graduate Course for Photon Science grant. R.K. acknowledges support by Grant-in-Aid for JSPS Research Fellow (JP16J01302).

Facilities: HST (WFC3, ACS)

REFERENCES

Arnouts, S., Schiminovich, D., Ilbert, O., et al. 2005, ApJ, 619, L43 Atek, H., Richard, J., Kneib, J.-P., et al. 2014, ApJ, 786, 60 Atek, H., Richard, J., Jauzac, M., et al. 2015a, ApJ, 814, 69 Atek, H., Richard, J., Kneib, J.-P., et al. 2015b, ApJ, 800, 18 Bennett, C. L., Larson, D., Weiland, J. L., et al. 2013, ApJS, 208, 20 Bernard, S. R., Carrasco, D., Trenti, M., et al. 2016, ApJ, 827, 76 Bertin, E., & Arnouts, S. 1996, A&AS, 117, 393 Bertin, E., Mellier, Y., Radovich, M., et al. 2002, in Astronomical Society of the Pacific Conference Series, Vol. 281, Astronomical Data Analysis Software and Systems XI, ed. D. A. Bohlender, D. Durand, & T. H. Handley, 228 Bolton, J. S., Haehnelt, M. G., Warren, S. J., et al. 2011, MNRAS, 416, L70 Bouwens, R. J., Illingworth, G. D., Oesch, P. A., et al. 2017a, ApJ, 843, 41 Bouwens, R. J., Oesch, P. A., Illingworth, G. D., Ellis, R. S., & Stefanon, M. 2017b, ApJ, 843, 129 Bouwens, R. J., Smit, R., Labbé, I., et al. 2016a, ApJ, 831, 176 Bouwens, R. J., Illingworth, G. D., Oesch, P. A., et al. 2014, ApJ, 793, 115 —. 2015, ApJ, 803, 34 Bouwens, R. J., Oesch, P. A., Labbé, I., et al. 2016b, ApJ, 830, 67 Bowler, R. A. A., Dunlop, J. S., McLure, R. J., et al. 2014, MNRAS, 440, 2810 Bradač, M., Treu, T., Applegate, D., et al. 2009, ApJ, 706, 1201 Bradley, L. D., Trenti, M., Oesch, P. A., et al. 2012, ApJ, 760, 108 Calvi, V., Trenti, M., Stiavelli, M., et al. 2016, ApJ, 817, 120 Carilli, C. L., Wang, R., Fan, X., et al. 2010, ApJ, 714, 834 Chornock, R., Berger, E., Fox, D. B., et al. 2014, ArXiv e-prints, arXiv:1405.7400 —. 2013, ApJ, 774, 26 Coe, D., Bradley, L., & Zitrin, A. 2015, ApJ, 800, 84 Coe, D., Zitrin, A., Carrasco, M., et al. 2013, ApJ, 762, 32 Dijkstra, M., Mesinger, A., & Wyithe, J. S. B. 2011, MNRAS, 414, 2139 Dunlop, J. S., McLure, R. J., Biggs, A. D., et al. 2017, MNRAS, 466, 861 Ellis, R. S., McLure, R. J., Dunlop, J. S., et al. 2013, ApJ, 763, L7 Fan, X., Strauss, M. A., Becker, R. H., et al. 2006, AJ, 132, 117 Faucher-Giguère, C.-A., Kereš, D., & Ma, C.-P. 2011, MNRAS, 417, 2982 Finkelstein, S. L., Ryan, Jr., R. E., Papovich, C., et al. 2015, ApJ, 810, 71 Finlator, K., Oh, S. P., Özel, F., & Davé, R. 2012, MNRAS, 427, 2464 Hinshaw, G., Larson, D., Komatsu, E., et al. 2013, ApJS, 208, 19 Hoag, A., Huang, K.-H., Treu, T., et al. 2016, ApJ, 831, 182 Iliev, I. T., Mellema, G., Pen, U.-L., et al. 2006, MNRAS, 369, 1625 Ishigaki, M., Kawamata, R., Ouchi, M., et al. 2015, ApJ, 799, 12 Ishigaki, M., Ouchi, M., & Harikane, Y. 2016, ApJ, 822, 5 Iwata, I., Inoue, A. K., Matsuda, Y., et al. 2009, ApJ, 692, 1287 Japelj, J., Vanzella, E., Fontanot, F., et al. 2017, MNRAS, 468, 389 Jauzac, M., Richard, J., Jullo, E., et al. 2015, MNRAS, 452, 1437

Full-Data Results of Hubble Frontier Fields 11

Figure 9. Left panel: ρ_{UV} calculated with M_{trunc} = −11.0. The black circles present ρ_{UV} from the best-fit luminosity functions at z ∼ 7 − 10 (this work) and those at z ∼ 4 − 6 (Bouwens et al. 2015). The blue line and the light blue shade denote the best-fit function of ρ_{UV} and the 1σ error, respectively, calculated with Equation (22) (see text for the best-fit parameters). The up-scattering ρ_{UV}(z) at z ∼ 10 due to the large uncertainty in α does not affect the fitting result, because the uncertainty in ρ_{UV}(z) is also large. Middle panel: τ_e integrating from z = 0 to a redshift z. The red line and the magenta shade represent τ_e(z) and the 1σ error, respectively, that are consistent with ρ_{UV}(z) shown with the blue line in the left panel. The black line and the gray region show the values of τ_e and its 1σ error, respectively, obtained by Planck Collaboration et al. (2016). Right panel: evolution of Q_{HII}. The green line and the light green shade present Q_{HII} and the 1σ error, respectively, that agree with ρ_{UV}(z) shown with the blue line in the left panel based on Equation 16. The symbols denote constraints of Q_{HII} from Ota et al. (2008) (filled circle), Konno et al. (2014) (open diamond), Carilli et al. (2010) (filled square), Bolton et al. (2011) (filled star), McQuinn et al. (2008) (open circle), Ouchi et al. (2010) (filled diamond), McQuinn et al. (2007) (filled pentagon), Mesinger (2010) (open triangle), McGreer et al. (2011) (open star), McQuinn et al. (2007); Mesinger & Furlanetto (2008); Dijkstra et al. (2011) (open pentagon), Chornock et al. (2013, 2014) (filled hexagons), Totani et al. (2014) (open hexagon), and Patel et al. (2010) (open square).

Figure 10. Contours at 68% (pink shade) and 95% (magenta shade) confidence levels of ⟨f_{esc}ξ_{ion}⟩ and M_{trunc} parameters. The upper horizontal axis represents ⟨f_{esc}ξ_{ion}⟩, and the lower horizontal axis denotes the average escape fraction ⟨f_{esc}⟩ under the assumption of log ξ_{ion}/[erg^{−1} Hz] = 25.34 (Bouwens et al. 2016a). The blue shade shows the 68% confidence contour calculated with the constraints of Δz from Planck Collaboration et al. (2016). The solid lines represent Δz = 1.0, 2.0, 3.0, and 5.0.

Johnson, T. L., Sharon, K., Bayliss, M. B., et al. 2014, ApJ, 797, 48 Kashikawa, N., Shimasaku, K., Matsuda, Y., et al. 2011, ApJ,

734, 119 Kawamata, R., Ishigaki, M., Shimasaku, K., Oguri, M., & Ouchi,

M. 2015, ApJ, 804, 103 Kawamata, R., Ishigaki, M., Shimasaku, K., et al. 2017, ArXiv

e-prints, arXiv:1710.07301 Kawamata, R., Oguri, M., Ishigaki, M., Shimasaku, K., & Ouchi,

M. 2016, ApJ, 819, 114 Konno, A., Ouchi, M., Ono, Y., et al. 2014, ApJ, 797, 16 Kuhlen, M., & Faucher-Giguère, C.-A. 2012, MNRAS, 423, 862 Laporte, N., Streblyanska, A., Clement, B., et al. 2014, A&A,

562, L8

Laporte, N., Streblyanska, A., Kim, S., et al. 2015, A&A, 575, A92 Laporte, N., Infante, L., Troncoso Iribarren, P., et al. 2016, ApJ, 820, 98 Livermore, R. C., Finkelstein, S. L., & Lotz, J. M. 2017, ApJ, 835, 113 Lotz, J. M., Koekemoer, A., Coe, D., et al. 2017, ApJ, 837, 97 Madau, P., & Dickinson, M. 2014, ARA&A, 52, 415 Madau, P., Ferguson, H. C., Dickinson, M. E., et al. 1996, MNRAS, 283, 1388 Madau, P., Pozzetti, L., & Dickinson, M. 1998, ApJ, 498, 106 McGreer, I. D., Mesinger, A., & Fan, X. 2011, MNRAS, 415, 3237 McLeod, D. J., McLure, R. J., & Dunlop, J. S. 2016, MNRAS, 459, 3812 McLeod, D. J., McLure, R. J., Dunlop, J. S., et al. 2015, MNRAS, 450, 3032 McLure, R. J., Dunlop, J. S., Bowler, R. A. A., et al. 2013, MNRAS, 432, 2696 McQuinn, M., Hernquist, L., Zaldarriaga, M., & Dutta, S. 2007, MNRAS, 381, 75 McQuinn, M., Lidz, A., Zaldarriaga, M., Hernquist, L., & Dutta, S. 2008, MNRAS, 388, 1101 Mesinger, A. 2010, MNRAS, 407, 1328 Mesinger, A., & Furlanetto, S. R. 2008, MNRAS, 386, 1990 Nakajima, K., Ellis, R. S., Iwata, I., et al. 2016, ApJ, 831, L9 Nestor, D. B., Shapley, A. E., Steidel, C. C., & Siana, B. 2011, ApJ, 736, 18 Oesch, P. A., Bouwens, R. J., Illingworth, G. D., et al. 2015, ApJ, 808, 104 —. 2013, ApJ, 773, 75 —. 2014, ApJ, 786, 108 Oguri, M. 2010, PASJ, 62, 1017 Ono, Y., Ouchi, M., Shimasaku, K., et al. 2010, ApJ, 724, 1524 Ono, Y., Ouchi, M., Mobasher, B., et al. 2012, ApJ, 744, 83 Ota, K., Iye, M., Kashikawa, N., et al. 2008, ApJ, 677, 12 Ouchi, M., Mobasher, B., Shimasaku, K., et al. 2009, ApJ, 706, 1136 Ouchi, M., Shimasaku, K., Furusawa, H., et al. 2010, ApJ, 723, 869 Patel, M., Warren, S. J., Mortlock, D. J., & Fynbo, J. P. U. 2010, A&A, 512, L3 Pentericci, L., Fontana, A., Vanzella, E., et al. 2011, ApJ, 743, 132 Pentericci, L., Vanzella, E., Fontana, A., et al. 2014, ApJ, 793, 113 Planck Collaboration, Ade, P. A. R., Aghanim, N., et al. 2014, A&A, 571, A16

12 Ishigaki et al.

Planck Collaboration, Adam, R., Aghanim, N., et al. 2016, A&A, 596, A108 Postman, M., Coe, D., Benítez, N., et al. 2012, ApJS, 199, 25 Ravindranath, S., Giavalisco, M., Ferguson, H. C., et al. 2006, ApJ, 652, 963 Reddy, N. A., & Steidel, C. C. 2009, ApJ, 692, 778 Robertson, B. E., Ellis, R. S., Furlanetto, S. R., & Dunlop, J. S.

2015, ApJ, 802, L19 Robertson, B. E., Furlanetto, S. R., Schneider, E., et al. 2013, ApJ, 768, 71 Schenker, M. A., Robertson, B. E., Ellis, R. S., et al. 2013, ApJ, 768, 196 Schiminovich, D., Ilbert, O., Arnouts, S., et al. 2005, ApJ, 619, L47 Schmidt, K. B., Treu, T., Trenti, M., et al. 2014, ApJ, 786, 57 Shapley, A. E., Steidel, C. C., Pettini, M., Adelberger, K. L., & Erb, D. K. 2006, ApJ, 651, 688 Shull, J. M., Harness, A., Trenti, M., & Smith, B. D. 2012, ApJ, 747, 100 Sokasian, A., Abel, T., Hernquist, L., & Springel, V. 2003, MNRAS, 344, 607

Steidel, C. C., Adelberger, K. L., Giavalisco, M., Dickinson, M., & Pettini, M. 1999, ApJ, 519, 1 Steidel, C. C., Pettini, M., & Adelberger, K. L. 2001, ApJ, 546, 665 Sugiura, N. 1978, Communications in Statistics - Theory and Methods, 7, 13 Totani, T., Kawai, N., Kosugi, G., et al. 2006, PASJ, 58, 485 Totani, T., Aoki, K., Hattori, T., et al. 2014, PASJ, 66, 63 Treu, T., Schmidt, K. B., Trenti, M., Bradley, L. D., & Stiavelli, M. 2013, ApJ, 775, L29 Treyer, M. A., Ellis, R. S., Milliard, B., Donas, J., & Bridges, T. J. 1998, MNRAS, 300, 303 Wang, X., Hoag, A., Huang, K.-H., et al. 2015, ApJ, 811, 29 Wyder, T. K., Treyer, M. A., Milliard, B., et al. 2005, ApJ, 619, L15 Zheng, W., Shu, X., Moustakas, J., et al. 2014, ApJ, 795, 93 Zitrin, A., Broadhurst, T., Umetsu, K., et al. 2009, MNRAS, 396, 1985 Zitrin, A., Meneghetti, M., Umetsu, K., et al. 2013, ApJ, 762, L30 Zitrin, A., Zheng, W., Broadhurst, T., et al. 2014, ApJ, 793, L12

APPENDIX

LISTS OF DROPOUT CANDIDATES AT Z ∼ 6 − 7, 8, AND 9

Table 4 Dropout candidates at z ∼ 6 − 7

ID R.A. (J2000) Dec (J2000) i_{814} − Y_{105} Y_{105} − J_{125} J_{125}^a μ^b Photo-z Reference^c

Abell2744 Cluster

HFF1C-2251-4556 3.593804 −30.415447 2.68 ± 0.36 0.05 ± 0.05 26.10 ± 0.04 3.64 6.62^{+0.75}_{−0.75} (1), (2), (7) HFF1C-1695-4527 3.570654 −30.414659 1.33 ± 0.10 0.11 ± 0.05 26.22 ± 0.04 1.47 6.00^{+0.69}_{−0.69} (1), (2) HFF1C-2549-3119 3.606222 −30.386644 1.07 ± 0.08 0.08 ± 0.05 26.26 ± 0.04 1.55 5.80^{+0.67}_{−0.67} (1), (2), (7) HFF1C-1930-4181 3.580452 −30.405043 > 2.36 0.17 ± 0.09 26.61 ± 0.07 4.47 6.79^{+0.76}_{−0.76} (1), (2), (7) HFF1C-2516-4570 3.604865 −30.415839 0.92 ± 0.14 0.06 ± 0.08 26.67 ± 0.06 2.84 5.64^{+0.65}_{−0.65} · · · HFF1C-2348-3454 3.597834 −30.395961 > 2.13 0.27 ± 0.11 26.79 ± 0.08 3.31 7.00^{+0.78}_{−0.78} (2), (7) HFF1C-2178-2458 3.590761 −30.379408 0.96 ± 0.14 −0.16 ± 0.10 27.07 ± 0.08 1.68 5.84^{+0.67}_{−0.67} (7) HFF1C-2047-3526 3.585321 −30.397958 > 1.83 0.13 ± 0.15 27.19 ± 0.11 3.23 6.75^{+0.76}_{−0.76} (2), (7), (10) HFF1C-2425-4143 3.601072 −30.403991 1.11 ± 0.24 0.00 ± 0.12 27.27 ± 0.10 3.74 5.95^{+0.68}_{−0.68} (1), (2), (7) HFF1C-2414-4370 3.600619 −30.410296 > 1.97 −0.06 ± 0.13 27.29 ± 0.10 11.88 6.39^{+0.72}_{−0.72} (2), (7) HFF1C-2482-2595 3.603426 −30.383219 0.87 ± 0.14 −0.13 ± 0.12 27.30 ± 0.10 1.48 5.78^{+0.66}_{−0.66} (2), (7) HFF1C-2477-4372 3.603214 −30.410350 > 1.89 −0.03 ± 0.14 27.34 ± 0.11 4.02 6.29^{+0.71}_{−0.71} (1), (2), (7), (10) HFF1C-2230-4479 3.592944 −30.413328 1.44 ± 0.33 −0.09 ± 0.14 27.36 ± 0.11 6.80 6.10^{+0.70}_{−0.70} (2), (7) HFF1C-1845-3107 3.576889 −30.386329 > 1.45 0.13 ± 0.19 27.46 ± 0.14 8.01 6.11^{+0.82}_{−0.70} (2), (7) HFF1C-2040-4471 3.585016 −30.413084 0.86 ± 0.17 −0.24 ± 0.15 27.46 ± 0.13 2.95 5.68^{+0.65}_{−4.73} · · · HFF1C-1911-4242 3.579635 −30.406723 1.06 ± 0.37 0.08 ± 0.20 27.53 ± 0.16 3.45 5.58^{+0.64}_{−5.25} · · · HFF1C-2616-3070 3.609003 −30.385283 1.35 ± 0.29 −0.07 ± 0.15 27.57 ± 0.12 1.44 6.05^{+0.69}_{−0.69} (2), (7) HFF1C-2509-4337 3.604563 −30.409364 1.43 ± 0.55 0.12 ± 0.19 27.63 ± 0.14 3.12 6.08^{+0.78}_{−0.75} (2), (7) HFF1C-2274-2562 3.594752 −30.382305 0.84 ± 0.23 −0.17 ± 0.18 27.73 ± 0.15 1.85 0.06^{+3.53}_{−0.06} · · · HFF1C-2364-4454 3.598515 −30.412612 > 1.18 0.16 ± 0.27 27.94 ± 0.19 15.56 6.58^{+0.80}_{−1.21} (7) HFF1C-1991-3429 3.582960 −30.395262 > 0.90 0.14 ± 0.28 27.97 ± 0.21 9.25 1.28^{+5.53}_{−1.07} (7) HFF1C-2172-2471 3.590518 −30.379763 > 1.36 −0.02 ± 0.26 28.10 ± 0.21 1.73 6.11^{+0.82}_{−1.11} (2), (7)

Abell2744 Parallel

HFF1P-5395-1452 3.474802 −30.362578 > 2.36 0.44 ± 0.08 26.64 ± 0.06 · · · 7.30^{+0.81}_{−0.81} · · · HFF1P-5292-4021 3.470509 −30.400605 0.83 ± 0.14 0.10 ± 0.09 26.96 ± 0.07 · · · 5.76^{+0.66}_{−0.66} · · · HFF1P-5793-1536 3.491387 −30.364890 > 2.19 0.42 ± 0.11 26.97 ± 0.07 · · · 7.33^{+0.82}_{−0.82} · · · HFF1P-5398-1451 3.474918 −30.362542 > 1.86 0.60 ± 0.12 26.98 ± 0.08 · · · 7.50^{+0.83}_{−1.52} · · · HFF1P-5535-2162 3.480642 −30.371175 1.79 ± 0.34 −0.05 ± 0.09 27.05 ± 0.07 · · · 6.32^{+0.72}_{−0.72} · · · HFF1P-5701-1517 3.487575 −30.364380 1.25 ± 0.27 0.32 ± 0.13 27.19 ± 0.09 · · · 5.65^{+0.65}_{−4.76} · · · HFF1P-5734-3406 3.488924 −30.394630 > 1.63 0.26 ± 0.13 27.24 ± 0.09 · · · 6.75^{+0.76}_{−0.79} · · · HFF1P-5581-2176 3.482550 −30.371559 1.19 ± 0.28 0.15 ± 0.11 27.25 ± 0.09 · · · 5.77^{+0.66}_{−0.93} · · · HFF1P-5615-3497 3.483960 −30.397152 1.72 ± 0.42 −0.00 ± 0.12 27.32 ± 0.10 · · · 6.26^{+0.71}_{−0.71} · · · HFF1P-5221-3488 3.467582 −30.396908 > 2.01 0.13 ± 0.13 27.36 ± 0.10 · · · 6.75^{+0.76}_{−0.76} · · ·

Full-Data Results of Hubble Frontier Fields 13

Table 4 — Continued

ID R.A. (J2000) Dec (J2000) i_{814} − Y_{105} Y_{105} − J_{125} J_{125}^a μ^b Photo-z Reference^c

HFF1P-5748-3583 3.489520 −30.399528 > 1.68 0.05 ± 0.14 27.39 ± 0.11 · · · 6.64^{+0.75}_{−0.75} · · · HFF1P-5210-3156 3.467097 −30.387686 1.30 ± 0.25 −0.26 ± 0.12 27.41 ± 0.10 · · · 6.06^{+0.69}_{−0.69} · · · HFF1P-5185-3398 3.466056 −30.394409 1.10 ± 0.26 −0.02 ± 0.15 27.54 ± 0.12 · · · 5.93^{+0.68}_{−0.68} · · · HFF1P-5573-2343 3.482238 −30.376221 0.94 ± 0.33 0.15 ± 0.17 27.65 ± 0.13 · · · 1.26^{+3.73}_{−1.08} · · · HFF1P-4940-1588 3.455844 −30.366359 1.04 ± 0.37 −0.03 ± 0.19 27.79 ± 0.15 · · · 5.60^{+0.65}_{−4.69} · · · HFF1P-5327-2576 3.471985 −30.382683 > 1.23 0.26 ± 0.21 27.84 ± 0.16 · · · 6.66^{+0.82}_{−2.06} · · · HFF1P-5054-1587 3.460587 −30.366320 0.94 ± 0.39 0.03 ± 0.21 27.87 ± 0.16 · · · 5.76^{+0.67}_{−1.30} · · · HFF1P-5587-3058 3.482833 −30.384961 0.97 ± 0.45 0.13 ± 0.20 27.87 ± 0.16 · · · 1.08^{+5.09}_{−0.92} · · · HFF1P-5687-3584 3.486988 −30.399579 0.98 ± 0.41 −0.08 ± 0.21 27.88 ± 0.17 · · · 5.89^{+0.68}_{−1.22} · · · HFF1P-5638-2369 3.484920 −30.376917 1.20 ± 0.50 0.11 ± 0.21 27.90 ± 0.16 · · · 5.95^{+0.71}_{−0.74} · · · HFF1P-5691-3514 3.487148 −30.397615 1.04 ± 0.40 −0.19 ± 0.21 27.90 ± 0.17 · · · 4.15^{+1.95}_{−4.04} · · · HFF1P-5429-2542 3.476220 −30.381741 > 1.47 −0.12 ± 0.21 27.98 ± 0.17 · · · 5.79^{+0.80}_{−5.54} · · · HFF1P-5509-1488 3.479545 −30.363580 > 1.35 0.06 ± 0.25 28.03 ± 0.20 · · · 4.68^{+0.92}_{−4.28} · · · HFF1P-5453-3095 3.477238 −30.385998 > 1.33 −0.19 ± 0.22 28.08 ± 0.19 · · · 6.46^{+0.73}_{−0.73} · · · HFF1P-4938-2422 3.455763 −30.378410 > 1.18 0.08 ± 0.26 28.12 ± 0.20 · · · 6.05^{+1.31}_{−5.19} · · · HFF1P-5381-3517 3.474216 −30.397703 > 1.09 0.14 ± 0.27 28.12 ± 0.21 · · · 6.30^{+0.92}_{−5.76} · · · HFF1P-5566-3224 3.481928 −30.389557 > 1.36 −0.26 ± 0.23 28.12 ± 0.20 · · · 6.17^{+0.70}_{−0.77} · · · HFF1P-5467-2421 3.477807 −30.378362 > 1.05 0.15 ± 0.26 28.13 ± 0.20 · · · 5.75^{+1.16}_{−5.13} · · · HFF1P-5445-2223 3.476915 −30.372888 > 1.22 −0.04 ± 0.25 28.16 ± 0.20 · · · 5.78^{+1.00}_{−5.17} · · · HFF1P-5588-2288 3.482859 −30.374682 0.91 ± 0.49 0.02 ± 0.27 28.24 ± 0.22 · · · 1.09^{+3.70}_{−1.03} · · · MACS0416 Cluster HFF2C-0949-5187 64.039545 −24.088540 1.08 ± 0.11 −0.01 ± 0.05 26.37 ± 0.04 1.54 5.88^{+0.67}_{−0.67} (7) HFF2C-1148-3434 64.047846 −24.062066 1.63 ± 0.13 −0.16 ± 0.06 26.64 ± 0.05 12.31 6.23^{+0.71}_{−0.71} (3), (7) HFF2C-1131-3400 64.047138 −24.061138 0.99 ± 0.11 −0.06 ± 0.08 26.93 ± 0.07 9.89 5.88^{+0.67}_{−0.67} (7) HFF2C-0899-3404 64.037485 −24.061238 1.26 ± 0.22 −0.01 ± 0.11 27.05 ± 0.09 3.21 6.04^{+0.69}_{−0.69} (3), (7) HFF2C-0828-5386 64.034514 −24.094074 1.08 ± 0.23 0.04 ± 0.15 27.22 ± 0.12 1.50 5.90^{+0.68}_{−0.68} (7) HFF2C-0960-3425 64.040012 −24.061830 1.74 ± 0.43 0.00 ± 0.14 27.32 ± 0.11 9.53 6.28^{+0.71}_{−0.71} (3), (7) HFF2C-1147-4580 64.047818 −24.082801 > 1.85 0.23 ± 0.13 27.38 ± 0.10 1.41 6.75^{+0.76}_{−0.76} (3), (7) HFF2C-1220-3595 64.050865 −24.066531 1.04 ± 0.19 −0.07 ± 0.12 27.38 ± 0.09 3.63 5.92^{+0.68}_{−0.68} (3), (7) HFF2C-1156-3446 64.048176 −24.062404 1.55 ± 0.24 −0.18 ± 0.12 27.41 ± 0.10 15.60 6.16^{+0.70}_{−0.70} (7) HFF2C-1181-3480 64.049226 −24.063349 1.76 ± 0.29 −0.22 ± 0.13 27.46 ± 0.11 26.13 6.27^{+0.71}_{−0.71} (7) HFF2C-0768-5032 64.032020 −24.084227 0.82 ± 0.26 −0.01 ± 0.20 27.47 ± 0.16 7.55 5.47^{+0.63}_{−5.10} · · · HFF2C-0743-3348 64.030960 −24.059683 > 1.49 0.32 ± 0.16 27.52 ± 0.11 1.75 1.39^{+5.98}_{−0.62} · · · HFF2C-1030-3258 64.042941 −24.057182 0.87 ± 0.21 −0.16 ± 0.16 27.52 ± 0.14 2.77 5.69^{+0.66}_{−0.66} (7) HFF2C-0778-3204 64.032450 −24.055671 1.14 ± 0.31 0.03 ± 0.14 27.53 ± 0.11 1.67 5.97^{+0.68}_{−0.68} (7) HFF2C-1105-5392 64.046063 −24.094241 > 1.71 0.03 ± 0.15 27.53 ± 0.11 1.23 6.50^{+0.74}_{−0.74} (7) HFF2C-0829-5229 64.034556 −24.089700 1.22 ± 0.32 −0.03 ± 0.20 27.54 ± 0.16 1.79 5.96^{+0.68}_{−0.91} (3), (7) HFF2C-0856-4435 64.035702 −24.078765 1.07 ± 0.42 0.16 ± 0.24 27.59 ± 0.18 14.19 1.09^{+5.11}_{−0.83} · · · HFF2C-1045-3324 64.043574 −24.059001 1.36 ± 0.33 −0.19 ± 0.17 27.59 ± 0.15 4.86 6.06^{+0.69}_{−0.69} · · · HFF2C-0933-3382 64.038890 −24.060637 > 1.68 0.00 ± 0.20 27.66 ± 0.16 3.72 6.41^{+0.73}_{−0.73} (7) HFF2C-1051-5500 64.043800 −24.097245 1.07 ± 0.42 0.17 ± 0.18 27.71 ± 0.13 1.23 1.29^{+5.05}_{−0.85} (7) HFF2C-1330-3565 64.055425 −24.065698 0.90 ± 0.26 0.00 ± 0.17 27.77 ± 0.13 2.30 5.75^{+0.66}_{−1.07} · · · HFF2C-1225-3594 64.051077 −24.066512 1.29 ± 0.36 0.02 ± 0.17 27.78 ± 0.13 3.53 6.03^{+0.69}_{−0.69} (7) HFF2C-1308-3431 64.054524 −24.061998 0.96 ± 0.21 −0.28 ± 0.19 27.89 ± 0.16 4.17 5.75^{+0.66}_{−0.66} (7) HFF2C-0771-3205 64.032155 −24.055706 1.03 ± 0.32 −0.31 ± 0.20 27.99 ± 0.18 1.69 5.82^{+0.67}_{−0.92} (7) HFF2C-0924-5133 64.038512 −24.087045 > 1.47 −0.36 ± 0.23 28.16 ± 0.20 1.71 6.24^{+0.71}_{−0.95} (7) MACS0416 Parallel HFF2P-3165-7300 64.131878 −24.125007 > 2.46 0.61 ± 0.06 26.34 ± 0.03 · · · 7.52^{+0.84}_{−0.84} · · · HFF2P-2773-7107 64.115583 −24.119644 2.28 ± 0.27 0.11 ± 0.04 26.38 ± 0.03 · · · 6.43^{+0.73}_{−0.73} · · · HFF2P-3552-5571 64.148027 −24.099201 > 2.41 0.51 ± 0.06 26.52 ± 0.04 · · · 6.32^{+0.98}_{−0.72} · · · HFF2P-2912-7330 64.121367 −24.125856 > 2.02 0.69 ± 0.11 26.93 ± 0.06 · · · 7.62^{+0.84}_{−0.84} · · · HFF2P-3660-5583 64.152506 −24.099529 0.91 ± 0.12 −0.09 ± 0.09 27.01 ± 0.07 · · · 5.81^{+0.67}_{−0.67} · · · HFF2P-3011-7264 64.125486 −24.124020 1.07 ± 0.20 −0.02 ± 0.08 27.13 ± 0.07 · · · 5.92^{+0.68}_{−0.68} · · · HFF2P-3514-6214 64.146433 −24.105965 2.18 ± 0.54 0.00 ± 0.09 27.15 ± 0.07 · · · 6.36^{+0.72}_{−0.72} · · · HFF2P-3809-6184 64.158736 −24.105133 0.92 ± 0.15 0.01 ± 0.10 27.16 ± 0.08 · · · 5.77^{+0.66}_{−0.66} · · · HFF2P-3597-6014 64.149901 −24.100414 > 1.80 0.38 ± 0.12 27.25 ± 0.08 · · · 7.20^{+0.80}_{−0.80} · · · HFF2P-2796-7156 64.116513 −24.121026 1.17 ± 0.31 0.07 ± 0.14 27.64 ± 0.11 · · · 5.99^{+0.68}_{−0.69} · · · HFF2P-3378-6338 64.140776 −24.109396 0.82 ± 0.28 0.10 ± 0.14 27.64 ± 0.11 · · · 5.41^{+0.63}_{−5.07} · · ·

14 Ishigaki et al.

Table 4 — Continued

ID R.A. (J2000) Dec (J2000) i_{814} − Y_{105} Y_{105} − J_{125} J_{125}^a μ^b Photo-z Reference^c

HFF2P-3253-6121 64.135552 −24.103380 > 1.41 0.12 ± 0.15 27.68 ± 0.11 · · · 6.63^{+0.75}_{−0.75} · · · HFF2P-3316-7571 64.138174 −24.132532 0.81 ± 0.25 −0.25 ± 0.15 27.75 ± 0.12 · · · 5.27^{+0.61}_{−4.78} · · · HFF2P-3241-7291 64.135067 −24.124757 > 1.27 0.26 ± 0.18 27.81 ± 0.12 · · · 1.36^{+4.94}_{−1.21} · · · HFF2P-3084-7172 64.128511 −24.121451 1.00 ± 0.30 −0.22 ± 0.15 27.85 ± 0.13 · · · 5.81^{+0.67}_{−0.67} · · · HFF2P-2909-7142 64.121231 −24.120634 > 1.48 0.18 ± 0.18 27.89 ± 0.13 · · · 6.11^{+0.88}_{−0.78} · · · HFF2P-3088-5573 64.128687 −24.099262 0.91 ± 0.41 −0.02 ± 0.18 27.92 ± 0.14 · · · 5.81^{+0.67}_{−0.74} · · · HFF2P-3151-6300 64.131331 −24.108356 1.40 ± 0.51 −0.21 ± 0.16 27.94 ± 0.14 · · · 6.12^{+0.70}_{−0.70} · · · HFF2P-3216-6167 64.134030 −24.104666 > 1.05 0.22 ± 0.19 27.96 ± 0.14 · · · 6.46^{+0.92}_{−5.40} · · · HFF2P-3429-6045 64.142896 −24.101277 > 1.42 −0.03 ± 0.18 27.96 ± 0.14 · · · 6.61^{+0.75}_{−0.75} · · · HFF2P-3441-8018 64.143391 −24.133838 > 1.02 0.19 ± 0.23 28.01 ± 0.16 · · · 1.28^{+5.17}_{−1.10} · · · HFF2P-3602-7428 64.150087 −24.128579 > 1.18 −0.07 ± 0.22 28.10 ± 0.17 · · · 6.01^{+0.79}_{−1.36} · · · HFF2P-3418-6426 64.142432 −24.111851 > 1.12 −0.15 ± 0.26 28.37 ± 0.21 · · · 1.35^{+5.41}_{−1.26} · · · MACS0717 Cluster HFF3C-3377-4319 109.390738 37.742218 1.09 ± 0.08 −0.07 ± 0.05 25.82 ± 0.04 62.36 5.97^{+0.68}_{−0.68} · · · HFF3C-3817-5168 109.409066 37.754681 1.52 ± 0.10 −0.05 ± 0.04 25.96 ± 0.04 4.88 6.20^{+0.71}_{−0.71} (6) HFF3C-3785-4338 109.407728 37.742740 1.48 ± 0.11 −0.07 ± 0.05 26.06 ± 0.04 8.66 6.18^{+0.70}_{−0.70} (6) HFF3C-3928-4047 109.413667 37.734645 2.13 ± 0.29 0.03 ± 0.07 26.45 ± 0.06 14.22 6.47^{+0.73}_{−0.73} (6) HFF3C-3578-5538 109.399102 37.764959 1.57 ± 0.21 −0.00 ± 0.07 26.52 ± 0.06 6.79 6.18^{+0.70}_{−0.70} (6) HFF3C-3908-4016 109.412846 37.733795 2.09 ± 0.33 0.12 ± 0.08 26.55 ± 0.06 22.49 6.50^{+0.74}_{−0.74} (6) HFF3C-3269-5069 109.386219 37.751924 1.73 ± 0.33 0.10 ± 0.09 26.66 ± 0.07 3.10 6.22^{+0.71}_{−0.71} (6) HFF3C-3342-3294 109.389277 37.724858 1.31 ± 0.27 0.12 ± 0.10 26.84 ± 0.07 2.35 6.03^{+0.69}_{−0.69} (6) HFF3C-3145-3537 109.381053 37.731611 1.43 ± 0.26 −0.05 ± 0.09 26.87 ± 0.08 3.54 6.13^{+0.70}_{−0.70} (6) HFF3C-3047-4112 109.376996 37.736450 1.31 ± 0.22 0.08 ± 0.10 26.96 ± 0.08 4.22 6.03^{+0.69}_{−0.69} (6) HFF3C-3389-4210 109.391220 37.739172 1.17 ± 0.49 0.22 ± 0.21 27.38 ± 0.16 26.64 5.86^{+0.98}_{−5.06} (6) HFF3C-3096-5100 109.379016 37.752792 1.04 ± 0.23 −0.17 ± 0.17 27.41 ± 0.15 5.04 5.87^{+0.67}_{−0.67} · · · HFF3C-3318-5132 109.388269 37.753667 0.82 ± 0.29 0.04 ± 0.18 27.42 ± 0.14 5.61 5.49^{+0.64}_{−4.77} · · · HFF3C-4047-4196 109.418650 37.738793 1.19 ± 0.30 −0.15 ± 0.18 27.48 ± 0.15 9.18 5.97^{+0.68}_{−0.68} (6) HFF3C-3810-4541 109.408780 37.748379 1.15 ± 0.33 −0.01 ± 0.19 27.53 ± 0.15 58.57 5.95^{+0.68}_{−0.68} · · · HFF3C-3585-5491 109.399393 37.763654 1.17 ± 0.46 0.18 ± 0.21 27.55 ± 0.16 7.31 5.74^{+0.90}_{−5.10} · · · HFF3C-3411-4573 109.392135 37.749271 0.97 ± 0.36 −0.02 ± 0.21 27.60 ± 0.17 9.14 5.60^{+0.65}_{−5.19} · · · HFF3C-2777-4506 109.365722 37.747409 > 1.44 0.20 ± 0.24 27.64 ± 0.18 4.63 6.15^{+0.98}_{−4.99} (6) HFF3C-3981-4481 109.415897 37.746722 > 1.67 −0.08 ± 0.22 27.70 ± 0.18 15.12 6.51^{+0.74}_{−0.74} (6) HFF3C-3096-4181 109.379034 37.738386 1.27 ± 0.39 −0.01 ± 0.18 27.73 ± 0.15 6.22 6.02^{+0.69}_{−0.76} (6) HFF3C-3510-5294 109.396250 37.758188 > 1.38 −0.12 ± 0.25 27.88 ± 0.21 8.62 6.21^{+0.71}_{−1.17} · · · HFF3C-3091-4467 109.378815 37.746314 > 1.72 −0.43 ± 0.24 28.11 ± 0.22 10.29 6.41^{+0.73}_{−0.73} · · · MACS0717 Parallel HFF3P-2342-9539 109.347598 37.831665 2.27 ± 0.25 0.13 ± 0.05 26.15 ± 0.04 · · · 6.48^{+0.73}_{−0.73} (6) HFF3P-2252-9555 109.343857 37.832091 1.61 ± 0.18 −0.04 ± 0.06 26.57 ± 0.05 · · · 6.22^{+0.71}_{−0.71} (6) HFF3P-1410-0378 109.308788 37.843848 > 2.06 0.41 ± 0.11 26.72 ± 0.07 · · · 7.14^{+0.80}_{−0.87} (6) HFF3P-2427-9379 109.351141 37.827197 2.37 ± 0.45 0.07 ± 0.08 26.72 ± 0.06 · · · 6.57^{+0.74}_{−0.74} (6) HFF3P-1604-9275 109.316835 37.824319 > 2.25 0.14 ± 0.09 26.84 ± 0.07 · · · 6.82^{+0.77}_{−0.77} (6) HFF3P-1906-8524 109.329441 37.814580 > 1.95 0.37 ± 0.10 26.86 ± 0.07 · · · 7.17^{+0.80}_{−0.80} · · · HFF3P-1778-9084 109.324122 37.819016 0.84 ± 0.14 −0.10 ± 0.08 26.90 ± 0.07 · · · 5.79^{+0.67}_{−0.67} (6) HFF3P-1705-9266 109.321068 37.824061 1.41 ± 0.36 0.39 ± 0.10 26.91 ± 0.07 · · · 5.90^{+1.14}_{−0.75} (6) HFF3P-1519-8364 109.313303 37.810113 > 2.23 0.14 ± 0.09 26.96 ± 0.07 · · · 6.77^{+0.76}_{−0.76} (6) HFF3P-1837-9275 109.326543 37.824306 1.39 ± 0.24 −0.06 ± 0.09 26.97 ± 0.07 · · · 6.10^{+0.70}_{−0.70} (6) HFF3P-1881-1103 109.328390 37.852862 1.64 ± 0.26 −0.17 ± 0.09 26.98 ± 0.07 · · · 6.22^{+0.71}_{−0.71} · · · HFF3P-1844-9166 109.326863 37.821291 0.83 ± 0.19 0.10 ± 0.10 27.02 ± 0.08 · · · 4.58^{+1.11}_{−3.88} · · · HFF3P-1855-8526 109.327331 37.814632 0.85 ± 0.16 −0.06 ± 0.10 27.03 ± 0.08 · · · 5.78^{+0.66}_{−0.66} (6) HFF3P-1977-9392 109.332397 37.827567 > 2.18 0.12 ± 0.11 27.08 ± 0.08 · · · 6.52^{+0.74}_{−0.74} (6) HFF3P-2364-9356 109.348503 37.826577 > 1.74 0.44 ± 0.14 27.19 ± 0.09 · · · 7.31^{+0.81}_{−1.22} (6) HFF3P-1762-0355 109.323430 37.843220 > 1.70 0.36 ± 0.13 27.22 ± 0.09 · · · 6.38^{+0.87}_{−5.23} (6) HFF3P-1696-0348 109.320698 37.843017 1.16 ± 0.27 0.07 ± 0.12 27.23 ± 0.09 · · · 5.87^{+0.67}_{−0.67} · · · HFF3P-1892-9418 109.328836 37.828302 > 2.00 −0.05 ± 0.12 27.24 ± 0.09 · · · 6.46^{+0.73}_{−0.73} (6) HFF3P-1188-9165 109.299505 37.821260 0.96 ± 0.19 −0.04 ± 0.12 27.31 ± 0.10 · · · 5.84^{+0.67}_{−0.67} · · · HFF3P-1399-9233 109.308292 37.823146 0.82 ± 0.19 −0.06 ± 0.14 27.45 ± 0.11 · · · 5.71^{+0.66}_{−0.66} (6) HFF3P-1527-9304 109.313633 37.825128 1.38 ± 0.36 −0.10 ± 0.15 27.46 ± 0.12 · · · 6.09^{+0.70}_{−0.70} · · · HFF3P-1840-9281 109.326706 37.824478 0.90 ± 0.28 0.03 ± 0.15 27.46 ± 0.12 · · · 5.65^{+0.65}_{−1.21} (6)

Full-Data Results of Hubble Frontier Fields 15

Table 4 — Continued

ID R.A. (J2000) Dec (J2000) i_{814} − Y_{105} Y_{105} − J_{125} J_{125}^a μ^b Photo-z Reference^c

HFF3P-1263-9215 109.302636 37.822653 > 1.96 0.03 ± 0.15 27.51 ± 0.12 · · · 6.53^{+0.74}_{−0.74} (6) HFF3P-1949-0448 109.331212 37.845804 1.40 ± 0.53 0.26 ± 0.18 27.55 ± 0.12 · · · 5.96^{+1.12}_{−5.02} (6) HFF3P-1319-0277 109.304963 37.841038 1.38 ± 0.46 0.17 ± 0.21 27.56 ± 0.16 · · · 5.82^{+0.81}_{−5.24} · · · HFF3P-2208-9465 109.342009 37.829592 1.03 ± 0.31 0.08 ± 0.17 27.59 ± 0.13 · · · 5.58^{+0.64}_{−4.94} (6) HFF3P-1307-9251 109.304485 37.823649 1.07 ± 0.23 −0.19 ± 0.15 27.61 ± 0.13 · · · 1.20^{+4.68}_{−1.06} · · · HFF3P-1477-9449 109.311563 37.829163 1.34 ± 0.56 0.27 ± 0.20 27.62 ± 0.14 · · · 6.05^{+0.99}_{−1.18} (6) HFF3P-1538-9217 109.314090 37.822717 > 1.30 0.33 ± 0.20 27.70 ± 0.14 · · · 6.61^{+0.83}_{−5.17} · · · HFF3P-1375-9505 109.307304 37.830722 1.01 ± 0.30 0.03 ± 0.18 27.71 ± 0.14 · · · 1.34^{+2.40}_{−1.29} · · · HFF3P-1373-9422 109.307223 37.828402 > 1.66 0.06 ± 0.19 27.77 ± 0.15 · · · 6.48^{+0.73}_{−0.73} (6) HFF3P-1489-0326 109.312054 37.842390 > 1.29 0.30 ± 0.21 27.77 ± 0.15 · · · 6.92^{+0.78}_{−5.84} (6) HFF3P-1810-0535 109.325457 37.848216 > 1.35 0.14 ± 0.20 27.79 ± 0.15 · · · 6.83^{+0.77}_{−1.43} (6) HFF3P-1151-9291 109.297969 37.824773 > 1.31 0.31 ± 0.23 27.86 ± 0.16 · · · 1.36^{+5.38}_{−1.19} · · · HFF3P-1813-0035 109.325574 37.834310 0.90 ± 0.40 0.04 ± 0.22 27.87 ± 0.17 · · · 5.58^{+0.64}_{−5.43} · · · HFF3P-1776-8528 109.324017 37.814689 1.15 ± 0.51 −0.05 ± 0.23 27.97 ± 0.18 · · · 5.72^{+0.84}_{−5.30} · · · HFF3P-1853-9354 109.327214 37.826505 0.90 ± 0.34 −0.25 ± 0.22 27.97 ± 0.18 · · · 5.60^{+0.65}_{−5.27} · · · HFF3P-2010-0108 109.333783 37.836334 0.87 ± 0.35 −0.04 ± 0.23 28.01 ± 0.18 · · · 5.63^{+0.65}_{−5.06} (6) HFF3P-1628-9029 109.317874 37.817496 0.87 ± 0.42 0.00 ± 0.25 28.08 ± 0.19 · · · 5.64^{+0.69}_{−5.28} · · · HFF3P-1936-9052 109.330679 37.818119 0.84 ± 0.40 −0.04 ± 0.25 28.14 ± 0.20 · · · 5.60^{+0.67}_{−5.23} · · · HFF3P-1494-9162 109.312291 37.821185 > 1.14 0.01 ± 0.27 28.18 ± 0.21 · · · 6.30^{+0.96}_{−4.99} · · · MACS1149 Cluster HFF4C-4025-5027 177.417749 22.417435 > 3.48 0.57 ± 0.03 25.21 ± 0.02 1.57 7.50^{+0.83}_{−0.83} · · · HFF4C-3888-4567 177.412018 22.415777 1.11 ± 0.05 0.12 ± 0.03 25.52 ± 0.02 1.94 5.81^{+0.67}_{−0.67} · · · HFF4C-3321-2566 177.388388 22.382390 1.67 ± 0.15 −0.07 ± 0.05 26.21 ± 0.04 1.74 6.27^{+0.71}_{−0.71} · · · HFF4C-3180-3434 177.382540 22.395401 0.86 ± 0.09 0.07 ± 0.06 26.30 ± 0.04 2.28 5.72^{+0.66}_{−0.66} · · · HFF4C-3911-5079 177.412999 22.418864 2.42 ± 0.36 0.03 ± 0.06 26.34 ± 0.05 1.70 6.47^{+0.73}_{−0.73} · · · HFF4C-3672-4342 177.403011 22.409501 1.07 ± 0.10 −0.07 ± 0.06 26.49 ± 0.05 3.68 5.96^{+0.68}_{−0.68} · · · HFF4C-4042-4205 177.418441 22.405696 0.91 ± 0.10 −0.09 ± 0.06 26.58 ± 0.05 1.77 5.84^{+0.67}_{−0.67} · · · HFF4C-3910-4491 177.412935 22.413642 2.26 ± 0.36 −0.19 ± 0.08 26.72 ± 0.07 1.87 6.41^{+0.73}_{−0.73} · · · HFF4C-4042-4207 177.418456 22.405770 0.97 ± 0.12 −0.11 ± 0.08 26.77 ± 0.06 1.77 5.87^{+0.67}_{−0.67} · · · HFF4C-4046-4231 177.418619 22.406430 1.06 ± 0.15 0.05 ± 0.08 26.81 ± 0.07 1.73 5.94^{+0.68}_{−0.68} · · · HFF4C-3952-5014 177.414690 22.417060 > 2.16 0.07 ± 0.11 27.04 ± 0.09 1.71 6.44^{+0.73}_{−0.73} · · · HFF4C-3906-4324 177.412777 22.409016 > 1.76 0.42 ± 0.12 27.09 ± 0.08 1.95 7.31^{+0.81}_{−1.09} · · · HFF4C-4047-4228 177.418635 22.406343 1.13 ± 0.19 −0.04 ± 0.10 27.09 ± 0.09 1.73 5.94^{+0.68}_{−0.68} · · · HFF4C-3705-4446 177.404410 22.412396 > 1.88 0.33 ± 0.13 27.14 ± 0.09 3.50 6.60^{+0.75}_{−0.83} · · · HFF4C-3830-3120 177.409606 22.386668 1.77 ± 0.45 0.11 ± 0.13 27.20 ± 0.10 6.20 6.27^{+0.71}_{−0.71} · · · HFF4C-3765-3173 177.406897 22.388148 0.98 ± 0.23 0.13 ± 0.13 27.21 ± 0.10 5.16 5.71^{+0.66}_{−4.82} · · · HFF4C-3889-3206 177.412079 22.389059 > 1.97 0.02 ± 0.14 27.31 ± 0.11 8.53 6.66^{+0.75}_{−0.75} · · · HFF4C-3433-2527 177.393042 22.381320 0.91 ± 0.26 0.08 ± 0.13 27.33 ± 0.10 1.76 5.83^{+0.67}_{−0.67} · · · HFF4C-4026-3382 177.417760 22.393947 1.11 ± 0.24 −0.01 ± 0.13 27.35 ± 0.10 3.17 5.86^{+0.67}_{−0.69} · · · HFF4C-3231-2579 177.384647 22.382754 1.23 ± 0.26 −0.23 ± 0.15 27.42 ± 0.13 1.68 6.00^{+0.69}_{−0.69} · · · HFF4C-3134-4050 177.380590 22.401408 > 2.08 −0.03 ± 0.14 27.43 ± 0.11 2.90 6.53^{+0.74}_{−0.74} · · · HFF4C-3191-4433 177.382991 22.412040 > 1.59 0.43 ± 0.18 27.43 ± 0.12 6.95 7.21^{+0.81}_{−1.34} · · · HFF4C-3665-4526 177.402725 22.414615 0.84 ± 0.21 −0.08 ± 0.15 27.45 ± 0.12 5.09 5.76^{+0.66}_{−0.66} · · · HFF4C-4076-4033 177.419863 22.400937 1.48 ± 0.47 0.26 ± 0.16 27.46 ± 0.12 2.08 6.09^{+0.78}_{−0.70} · · · HFF4C-3760-3035 177.406675 22.384327 > 1.73 0.04 ± 0.17 27.53 ± 0.13 6.53 6.58^{+0.74}_{−0.74} · · · HFF4C-3791-4415 177.407983 22.411538 1.54 ± 0.43 −0.02 ± 0.16 27.54 ± 0.13 2.36 6.15^{+0.70}_{−0.70} · · · HFF4C-3894-3418 177.412259 22.394967 > 1.55 0.12 ± 0.18 27.57 ± 0.13 7.09 6.63^{+0.75}_{−0.75} · · · HFF4C-3305-4210 177.387710 22.405836 0.89 ± 0.26 0.05 ± 0.17 27.62 ± 0.13 11.21 5.81^{+0.67}_{−0.67} · · · HFF4C-3892-3416 177.412203 22.394890 > 1.40 0.10 ± 0.20 27.72 ± 0.15 7.26 6.62^{+0.75}_{−0.75} · · · HFF4C-3736-5005 177.405705 22.416817 > 1.34 0.25 ± 0.22 27.76 ± 0.16 2.58 6.54^{+0.78}_{−1.23} · · · HFF4C-4205-3155 177.425223 22.387645 1.65 ± 0.52 −0.05 ± 0.20 27.77 ± 0.16 2.26 1.29^{+5.34}_{−0.43} · · · HFF4C-3991-3123 177.416321 22.386751 1.12 ± 0.41 0.09 ± 0.22 27.85 ± 0.18 3.56 5.81^{+0.71}_{−4.83} · · · HFF4C-3405-3155 177.391898 22.387646 1.22 ± 0.52 0.03 ± 0.22 27.86 ± 0.16 2.38 1.33^{+5.12}_{−1.15} · · · HFF4C-3419-3006 177.392475 22.383510 0.82 ± 0.31 −0.18 ± 0.20 27.87 ± 0.16 1.93 5.62^{+0.65}_{−4.57} · · · HFF4C-3595-4157 177.399818 22.404384 0.84 ± 0.40 0.09 ± 0.27 27.92 ± 0.20 684.51 0.31^{+3.68}_{−0.27} · · · HFF4C-3312-2565 177.388012 22.382380 > 1.45 −0.13 ± 0.25 27.93 ± 0.20 1.73 6.24^{+0.72}_{−0.93} · · · HFF4C-4082-3192 177.420086 22.388672 0.89 ± 0.25 −0.31 ± 0.21 27.93 ± 0.19 3.01 5.64^{+0.65}_{−4.95} · · · HFF4C-3225-2532 177.384407 22.381448 1.23 ± 0.44 −0.21 ± 0.25 27.95 ± 0.21 1.63 1.35^{+4.93}_{−1.29} · · ·

16 Ishigaki et al.

Table 4 — Continued

ID R.A. (J2000) Dec (J2000) i_{814} − Y_{105} Y_{105} − J_{125} J_{125}^a μ^b Photo-z Reference^c

HFF4C-3345-3553 177.389398 22.398695 0.93 ± 0.38 −0.08 ± 0.26 27.96 ± 0.21 6.34 0.31^{+4.63}_{−0.26} · · · HFF4C-3282-4046 177.386778 22.401297 0.85 ± 0.24 −0.45 ± 0.22 28.06 ± 0.19 5.23 5.63^{+0.65}_{−0.65} · · · HFF4C-3829-4199 177.409561 22.405545 > 1.09 0.01 ± 0.28 28.17 ± 0.22 2.45 6.27^{+0.82}_{−1.57} · · · MACS1149 Parallel HFF4P-3938-8196 177.414121 22.305448 3.02 ± 0.40 0.26 ± 0.02 25.43 ± 0.02 · · · 6.74^{+0.76}_{−0.76} · · · HFF4P-4461-7461 177.435880 22.296142 > 2.90 0.64 ± 0.04 25.82 ± 0.02 · · · 7.54^{+0.84}_{−0.84} · · · HFF4P-4423-8329 177.434292 22.309154 2.89 ± 0.46 0.28 ± 0.03 25.87 ± 0.02 · · · 7.13^{+0.80}_{−0.80} · · · HFF4P-3681-7168 177.403385 22.288000 1.47 ± 0.22 0.01 ± 0.06 26.46 ± 0.05 · · · 6.15^{+0.70}_{−0.70} · · · HFF4P-4005-7307 177.416916 22.291875 > 2.30 0.09 ± 0.06 26.59 ± 0.05 · · · 6.80^{+0.76}_{−0.76} · · · HFF4P-3742-7453 177.405922 22.295927 1.31 ± 0.19 −0.01 ± 0.06 26.64 ± 0.05 · · · 6.02^{+0.69}_{−0.69} · · · HFF4P-3815-7490 177.408969 22.296968 1.27 ± 0.23 0.15 ± 0.07 26.73 ± 0.06 · · · 5.94^{+0.68}_{−0.68} · · · HFF4P-4208-8047 177.425354 22.301318 1.57 ± 0.27 −0.07 ± 0.07 26.79 ± 0.06 · · · 6.20^{+0.71}_{−0.71} · · · HFF4P-3678-7409 177.403268 22.294703 > 1.77 0.47 ± 0.10 26.88 ± 0.06 · · · 7.16^{+0.80}_{−1.00} · · · HFF4P-3695-7381 177.403979 22.293922 > 1.75 0.44 ± 0.10 26.93 ± 0.07 · · · 7.15^{+0.80}_{−1.15} · · · HFF4P-3832-7190 177.409706 22.288622 1.95 ± 0.46 0.04 ± 0.08 26.94 ± 0.07 · · · 6.36^{+0.72}_{−0.72} · · · HFF4P-4539-7124 177.439130 22.286794 1.45 ± 0.24 −0.08 ± 0.09 27.14 ± 0.08 · · · 6.15^{+0.70}_{−0.70} · · · HFF4P-4497-8060 177.437411 22.301678 > 1.94 0.14 ± 0.11 27.16 ± 0.08 · · · 6.87^{+0.77}_{−0.77} · · · HFF4P-4269-8288 177.427882 22.308024 1.18 ± 0.28 −0.04 ± 0.10 27.17 ± 0.08 · · · 6.00^{+0.69}_{−0.69} · · · HFF4P-4045-8214 177.418575 22.305965 1.30 ± 0.47 0.33 ± 0.12 27.24 ± 0.09 · · · 5.81^{+1.03}_{−4.88} · · · HFF4P-4194-8047 177.424789 22.301318 1.02 ± 0.30 0.07 ± 0.11 27.27 ± 0.09 · · · 5.86^{+0.67}_{−0.67} · · · HFF4P-4372-7404 177.432202 22.294557 > 1.65 0.39 ± 0.13 27.33 ± 0.09 · · · 7.08^{+0.79}_{−1.21} · · · HFF4P-3881-7423 177.411719 22.295094 > 1.41 0.10 ± 0.14 27.48 ± 0.11 · · · 6.75^{+0.76}_{−0.76} · · · HFF4P-4133-6595 177.422215 22.283195 1.47 ± 0.41 0.00 ± 0.13 27.48 ± 0.11 · · · 6.11^{+0.70}_{−0.70} · · · HFF4P-3549-8309 177.397916 22.308605 > 1.44 0.18 ± 0.18 27.67 ± 0.13 · · · 6.50^{+0.74}_{−0.83} · · · HFF4P-4005-7321 177.416898 22.292273 > 1.25 0.07 ± 0.16 27.67 ± 0.13 · · · 6.62^{+0.75}_{−0.75} · · · HFF4P-4399-8595 177.433312 22.316552 > 1.33 0.02 ± 0.16 27.70 ± 0.13 · · · 5.65^{+1.13}_{−5.46} · · · HFF4P-4459-7323 177.435824 22.292329 0.94 ± 0.29 −0.00 ± 0.16 27.70 ± 0.13 · · · 5.44^{+0.63}_{−5.14} · · · HFF4P-3860-7488 177.410866 22.296898 0.93 ± 0.45 0.10 ± 0.17 27.73 ± 0.14 · · · 5.68^{+0.85}_{−5.08} · · · HFF4P-4250-7424 177.427107 22.295124 > 1.41 −0.02 ± 0.18 27.81 ± 0.15 · · · 6.47^{+0.73}_{−0.73} · · · HFF4P-4529-8297 177.438743 22.308265 > 1.35 0.07 ± 0.19 27.81 ± 0.15 · · · 6.53^{+0.74}_{−0.74} · · · HFF4P-4163-8238 177.423498 22.306622 1.41 ± 0.54 −0.22 ± 0.17 27.83 ± 0.14 · · · 6.09^{+0.70}_{−0.70} · · · HFF4P-3731-7203 177.405478 22.288982 > 1.29 −0.18 ± 0.20 27.84 ± 0.17 · · · 6.08^{+0.69}_{−0.92} · · · HFF4P-3841-8191 177.410083 22.305310 1.03 ± 0.55 0.15 ± 0.20 27.84 ± 0.16 · · · 1.32^{+4.75}_{−1.11} · · · HFF4P-4380-7515 177.432540 22.297653 0.90 ± 0.37 0.13 ± 0.20 27.87 ± 0.15 · · · 1.17^{+4.70}_{−0.73} · · · HFF4P-3653-8000 177.402242 22.300011 > 1.34 0.06 ± 0.20 27.89 ± 0.16 · · · 6.48^{+0.73}_{−0.73} · · · HFF4P-4110-8223 177.421272 22.306213 > 1.17 −0.04 ± 0.19 27.91 ± 0.15 · · · 6.13^{+0.79}_{−1.38} · · · HFF4P-3924-7397 177.413514 22.294386 > 1.16 −0.11 ± 0.20 27.94 ± 0.16 · · · 6.39^{+0.72}_{−0.82} · · · HFF4P-4417-9034 177.434056 22.317617 > 0.95 0.14 ± 0.21 27.97 ± 0.16 · · · 1.27^{+4.75}_{−1.14} · · · HFF4P-3614-8432 177.400593 22.312020 > 1.13 0.15 ± 0.24 28.04 ± 0.19 · · · 1.35^{+4.92}_{−1.28} · · · HFF4P-4579-7587 177.440827 22.299655 1.02 ± 0.40 −0.07 ± 0.22 28.04 ± 0.18 · · · 1.26^{+4.87}_{−0.94} · · · HFF4P-4380-7427 177.432518 22.295209 > 1.35 −0.17 ± 0.24 28.19 ± 0.20 · · · 6.09^{+0.70}_{−0.92} · · · AbellS1063 Cluster HFF5C-4581-2148 342.190894 −44.537462 1.13 ± 0.02 −0.05 ± 0.01 24.62 ± 0.01 5.99 5.97^{+0.68}_{−0.68} · · · HFF5C-4537-1480 342.189052 −44.530026 1.12 ± 0.03 −0.01 ± 0.01 24.86 ± 0.01 4.29 6.00^{+0.69}_{−0.69} · · · HFF5C-4111-1112 342.171301 −44.519801 1.03 ± 0.05 −0.01 ± 0.03 25.54 ± 0.02 2.47 5.92^{+0.68}_{−0.68} · · · HFF5C-4265-2489 342.177715 −44.546931 1.41 ± 0.16 −0.01 ± 0.07 26.69 ± 0.05 3.28 6.13^{+0.70}_{−0.70} · · · HFF5C-4159-1333 342.173329 −44.525929 1.03 ± 0.16 0.01 ± 0.08 26.76 ± 0.06 6.09 5.92^{+0.68}_{−0.68} · · · HFF5C-4227-2335 342.176131 −44.542664 1.19 ± 0.16 −0.04 ± 0.08 26.91 ± 0.06 10.22 6.02^{+0.69}_{−0.69} · · · HFF5C-4017-0457 342.167376 −44.512709 1.10 ± 0.24 0.18 ± 0.10 27.06 ± 0.07 1.72 1.15^{+4.62}_{−0.53} · · · HFF5C-3822-2382 342.159275 −44.543958 > 2.14 0.06 ± 0.12 27.33 ± 0.10 4.40 6.47^{+0.73}_{−0.73} · · · HFF5C-4877-1209 342.203210 −44.522476 > 1.62 0.31 ± 0.16 27.48 ± 0.11 8.30 6.16^{+1.15}_{−4.88} · · · HFF5C-3944-1488 342.164364 −44.530226 1.09 ± 0.27 −0.14 ± 0.15 27.57 ± 0.12 5.87 5.94^{+0.68}_{−0.68} · · · HFF5C-3998-0372 342.166608 −44.510345 > 1.46 0.24 ± 0.17 27.57 ± 0.12 1.60 6.67^{+0.75}_{−0.93} · · · HFF5C-4213-1414 342.175551 −44.528186 1.31 ± 0.44 −0.04 ± 0.18 27.66 ± 0.15 58.03 6.03^{+0.69}_{−0.75} · · · HFF5C-4186-1141 342.174445 −44.520605 > 1.23 0.15 ± 0.22 27.81 ± 0.17 3.02 6.04^{+1.05}_{−5.51} · · · HFF5C-4650-2338 342.193770 −44.542729 0.91 ± 0.29 −0.19 ± 0.18 27.82 ± 0.15 2.55 5.64^{+0.65}_{−5.45} · · · HFF5C-3930-1274 342.163789 −44.524303 0.89 ± 0.26 −0.21 ± 0.18 27.83 ± 0.15 2.56 5.65^{+0.65}_{−0.65} · · · HFF5C-4509-1101 342.187910 −44.519484 0.94 ± 0.34 −0.01 ± 0.20 27.86 ± 0.16 9.31 5.78^{+0.66}_{−0.82} · · ·

Full-Data Results of Hubble Frontier Fields 17

Table 4 — Continued

ID R.A. (J2000) Dec (J2000) i_{814} − Y_{105} Y_{105} − J_{125} J_{125}^a μ^b Photo-z Reference^c

HFF5C-3913-2297 342.163049 −44.541595 1.57 ± 0.43 −0.23 ± 0.19 27.89 ± 0.16 8.72 6.18^{+0.70}_{−0.70} · · · HFF5C-4414-2071 342.183917 −44.535313 > 1.40 −0.15 ± 0.27 27.90 ± 0.21 16.73 6.26^{+0.71}_{−0.75} · · · HFF5C-4493-2466 342.187221 −44.546282 0.83 ± 0.31 −0.13 ± 0.20 27.92 ± 0.16 2.50 5.58^{+0.64}_{−5.48} · · · HFF5C-3977-0487 342.165711 −44.513540 0.80 ± 0.31 −0.17 ± 0.20 27.96 ± 0.17 1.75 5.41^{+0.63}_{−5.14} · · · HFF5C-3960-0509 342.165033 −44.514157 0.86 ± 0.35 −0.09 ± 0.21 27.97 ± 0.17 1.78 5.66^{+0.65}_{−4.63} · · · HFF5C-4260-1364 342.177526 −44.526787 1.07 ± 0.46 −0.13 ± 0.25 28.03 ± 0.21 20.38 5.86^{+0.70}_{−5.14} · · · HFF5C-4039-1566 342.168321 −44.532412 0.82 ± 0.40 0.03 ± 0.25 28.06 ± 0.19 51.62 5.33^{+0.73}_{−5.11} · · · AbellS1063 Parallel HFF5P-1436-3153 342.309861 −44.554260 1.91 ± 0.12 0.13 ± 0.03 25.79 ± 0.02 · · · 6.29^{+0.71}_{−0.71} · · · HFF5P-1475-2258 342.311461 −44.540502 1.69 ± 0.11 0.02 ± 0.03 25.88 ± 0.02 · · · 6.30^{+0.71}_{−0.72} · · · HFF5P-1436-3158 342.309845 −44.554390 1.82 ± 0.13 0.16 ± 0.03 25.94 ± 0.02 · · · 6.22^{+0.71}_{−0.71} · · · HFF5P-1554-3415 342.314784 −44.561532 2.25 ± 0.17 −0.20 ± 0.04 26.22 ± 0.03 · · · 6.42^{+0.73}_{−0.73} · · · HFF5P-1915-3110 342.329811 −44.553074 2.60 ± 0.35 −0.10 ± 0.04 26.34 ± 0.04 · · · 6.50^{+0.74}_{−0.74} · · · HFF5P-2129-2064 342.338729 −44.535120 > 2.62 0.56 ± 0.06 26.36 ± 0.04 · · · 7.44^{+0.83}_{−0.83} · · · HFF5P-1929-2524 342.330388 −44.547896 > 2.74 0.17 ± 0.05 26.40 ± 0.04 · · · 6.83^{+0.77}_{−0.77} · · · HFF5P-1550-3408 342.314621 −44.561337 > 3.06 −0.18 ± 0.06 26.66 ± 0.05 · · · 6.47^{+0.73}_{−0.73} · · · HFF5P-1742-2148 342.322622 −44.537448 > 2.52 0.12 ± 0.06 26.69 ± 0.05 · · · 6.85^{+0.77}_{−0.77} · · · HFF5P-1200-3107 342.300031 −44.552973 1.89 ± 0.27 0.11 ± 0.07 26.75 ± 0.05 · · · 6.27^{+0.71}_{−0.71} · · · HFF5P-2195-1585 342.341480 −44.532925 2.07 ± 0.24 −0.26 ± 0.07 26.92 ± 0.06 · · · 6.38^{+0.72}_{−0.72} · · · HFF5P-1375-1572 342.307308 −44.532566 > 1.90 0.43 ± 0.11 26.95 ± 0.07 · · · 7.31^{+0.81}_{−1.67} · · · HFF5P-1545-2093 342.314400 −44.535944 2.13 ± 0.51 −0.12 ± 0.10 27.24 ± 0.08 · · · 6.40^{+0.72}_{−0.73} · · · HFF5P-1587-2418 342.316159 −44.544962 0.95 ± 0.19 −0.15 ± 0.11 27.34 ± 0.09 · · · 5.83^{+0.67}_{−0.67} · · · HFF5P-2100-3210 342.337526 −44.555841 1.27 ± 0.25 −0.12 ± 0.12 27.44 ± 0.10 · · · 6.04^{+0.69}_{−0.69} · · · HFF5P-1653-1381 342.318877 −44.527252 1.21 ± 0.26 −0.12 ± 0.13 27.54 ± 0.11 · · · 5.96^{+0.68}_{−0.68} · · · HFF5P-2357-2040 342.348226 −44.534471 1.05 ± 0.23 −0.02 ± 0.14 27.58 ± 0.11 · · · 5.83^{+0.67}_{−0.67} · · · HFF5P-1200-3339 342.300002 −44.559444 1.68 ± 0.42 −0.02 ± 0.15 27.61 ± 0.12 · · · 6.21^{+0.71}_{−0.71} · · · HFF5P-1512-3461 342.313006 −44.562829 > 1.84 0.09 ± 0.15 27.61 ± 0.12 · · · 6.26^{+0.75}_{−0.71} · · · HFF5P-1537-2327 342.314047 −44.542428 1.21 ± 0.46 0.24 ± 0.16 27.65 ± 0.12 · · · 5.82^{+1.00}_{−5.04} · · · HFF5P-1372-3301 342.307199 −44.558381 > 1.68 0.21 ± 0.17 27.68 ± 0.13 · · · 6.58^{+0.74}_{−0.74} · · · HFF5P-1870-3096 342.327941 −44.552684 1.03 ± 0.43 0.19 ± 0.18 27.78 ± 0.13 · · · 1.37^{+2.50}_{−1.32} · · · HFF5P-1423-3086 342.309306 −44.552397 1.78 ± 0.48 −0.20 ± 0.16 27.80 ± 0.13 · · · 6.25^{+0.71}_{−0.71} · · · HFF5P-2243-2024 342.343497 −44.534020 1.03 ± 0.31 0.10 ± 0.18 27.81 ± 0.14 · · · 5.86^{+0.67}_{−0.67} · · · HFF5P-1545-2521 342.314408 −44.547811 1.42 ± 0.47 −0.10 ± 0.18 27.91 ± 0.15 · · · 6.11^{+0.70}_{−0.70} · · · HFF5P-1255-3099 342.302320 −44.552756 1.07 ± 0.35 0.01 ± 0.19 27.93 ± 0.15 · · · 5.87^{+0.67}_{−5.07} · · · HFF5P-2068-3353 342.336177 −44.559817 > 1.38 0.03 ± 0.21 27.95 ± 0.17 · · · 6.41^{+0.73}_{−5.52} · · · HFF5P-1449-2384 342.310396 −44.544023 > 1.48 −0.12 ± 0.19 27.97 ± 0.16 · · · 6.12^{+0.70}_{−0.70} · · · HFF5P-2116-2400 342.338198 −44.544472 0.89 ± 0.36 0.13 ± 0.22 27.97 ± 0.17 · · · 5.68^{+0.65}_{−5.49} · · · HFF5P-2227-3287 342.342824 −44.557990 0.91 ± 0.32 −0.39 ± 0.24 28.17 ± 0.22 · · · 5.58^{+0.64}_{−0.65} · · · HFF5P-1957-1523 342.331570 −44.531212 1.10 ± 0.39 −0.13 ± 0.24 28.18 ± 0.20 · · · 5.79^{+0.67}_{−0.71} · · · HFF5P-1908-3457 342.329506 −44.562705 0.92 ± 0.50 0.11 ± 0.26 28.19 ± 0.21 · · · 0.27^{+5.83}_{−0.20} · · · HFF5P-1949-2315 342.331243 −44.542096 0.95 ± 0.39 −0.12 ± 0.24 28.20 ± 0.20 · · · 5.64^{+0.69}_{−5.16} · · · HFF5P-1940-3315 342.330870 −44.558773 0.94 ± 0.54 0.16 ± 0.27 28.21 ± 0.21 · · · 5.66^{+1.16}_{−5.11} · · · HFF5P-1716-2450 342.321503 −44.545838 0.96 ± 0.48 0.05 ± 0.25 28.22 ± 0.20 · · · 5.66^{+0.80}_{−5.37} · · · HFF5P-2055-2411 342.335663 −44.544752 > 1.16 0.03 ± 0.27 28.25 ± 0.21 · · · 1.36^{+3.06}_{−1.31} · · · HFF5P-1992-3212 342.333018 −44.555916 > 1.07 −0.02 ± 0.26 28.26 ± 0.21 · · · 6.45^{+0.73}_{−1.04} · · · HFF5P-1226-3152 342.301115 −44.554238 1.05 ± 0.44 −0.09 ± 0.25 28.27 ± 0.21 · · · 5.87^{+0.67}_{−1.29} · · · HFF5P-1542-1441 342.314282 −44.528924 > 1.10 0.07 ± 0.27 28.29 ± 0.22 · · · 5.93^{+0.93}_{−5.29} · · · Abell370 Cluster HFF6C-5526-4003 39.980271 −1.566761 0.92 ± 0.07 −0.12 ± 0.07 26.11 ± 0.06 13.34 5.85^{+0.67}_{−0.67} · · · HFF6C-5522-4002 39.980113 −1.566731 0.85 ± 0.08 −0.26 ± 0.09 26.48 ± 0.08 12.40 5.75^{+0.66}_{−0.66} · · · HFF6C-5715-4130 39.988155 −1.570302 0.81 ± 0.15 0.05 ± 0.14 26.72 ± 0.11 3.36 5.42^{+0.63}_{−1.08} · · · HFF6C-5659-4166 39.985811 −1.571303 1.50 ± 0.24 −0.01 ± 0.14 26.76 ± 0.11 4.35 6.16^{+0.70}_{−0.70} · · · HFF6C-4926-4158 39.955258 −1.571082 0.88 ± 0.14 0.06 ± 0.11 26.77 ± 0.10 3.62 5.83^{+0.67}_{−0.67} · · · HFF6C-5262-3591 39.969255 −1.566441 1.39 ± 0.27 −0.28 ± 0.17 27.09 ± 0.15 4.21 6.09^{+0.70}_{−0.70} · · · HFF6C-5001-4358 39.958395 −1.576620 1.69 ± 0.43 −0.27 ± 0.23 27.60 ± 0.21 4.26 6.19^{+0.70}_{−0.70} · · · Abell370 Parallel HFF6P-1557-6475 40.064896 −1.613212 1.47 ± 0.02 0.11 ± 0.01 24.41 ± 0.01 · · · 6.05^{+0.69}_{−0.69} · · ·

18 Ishigaki et al.

Table 4 — Continued

ID R.A. (J2000) Dec (J2000) i_{814} − Y_{105} Y_{105} − J_{125} J_{125}^a μ^b Photo-z Reference^c

HFF6P-1405-7142 40.058557 −1.620629 3.55 ± 0.44 0.28 ± 0.02 25.23 ± 0.01 · · · 7.14^{+0.80}_{−0.80} · · · HFF6P-1422-8041 40.059266 −1.634499 1.83 ± 0.13 0.04 ± 0.03 25.84 ± 0.02 · · · 6.27^{+0.71}_{−0.71} · · · HFF6P-1512-7449 40.063019 −1.629157 2.07 ± 0.18 0.05 ± 0.03 25.96 ± 0.03 · · · 6.41^{+0.73}_{−0.73} · · · HFF6P-1066-7101 40.044450 −1.619499 1.31 ± 0.10 0.02 ± 0.04 26.26 ± 0.04 · · · 6.01^{+0.69}_{−0.69} · · · HFF6P-1553-6472 40.064711 −1.613127 1.88 ± 0.23 0.21 ± 0.05 26.37 ± 0.04 · · · 6.32^{+0.72}_{−0.72} · · · HFF6P-0962-7254 40.040085 −1.623733 1.43 ± 0.12 −0.10 ± 0.05 26.47 ± 0.04 · · · 6.15^{+0.70}_{−0.70} · · · HFF6P-1112-8152 40.046339 −1.637564 1.10 ± 0.13 0.16 ± 0.06 26.60 ± 0.05 · · · 5.19^{+0.67}_{−0.61} · · · HFF6P-1365-7298 40.056894 −1.624969 1.03 ± 0.17 0.09 ± 0.07 26.84 ± 0.06 · · · 1.06^{+0.31}_{−0.61} · · · HFF6P-1338-7507 40.055776 −1.630760 2.21 ± 0.44 0.05 ± 0.08 26.90 ± 0.06 · · · 6.45^{+0.73}_{−0.73} · · · HFF6P-1443-8334 40.060155 −1.642617 1.03 ± 0.16 −0.14 ± 0.09 27.04 ± 0.07 · · · 5.89^{+0.68}_{−0.68} · · · HFF6P-1496-6574 40.062337 −1.615954 > 1.95 0.29 ± 0.10 27.07 ± 0.08 · · · 7.11^{+0.80}_{−0.79} · · · HFF6P-1135-6350 40.047325 −1.609738 > 1.87 0.34 ± 0.11 27.11 ± 0.08 · · · 6.30^{+0.84}_{−0.72} · · · HFF6P-1233-7093 40.051408 −1.619257 > 2.18 0.04 ± 0.10 27.12 ± 0.08 · · · 6.51^{+0.74}_{−0.74} · · · HFF6P-1242-7083 40.051751 −1.618991 1.74 ± 0.36 −0.04 ± 0.10 27.17 ± 0.08 · · · 6.30^{+0.71}_{−0.72} · · · HFF6P-1203-7168 40.050146 −1.621357 > 1.94 0.21 ± 0.11 27.18 ± 0.08 · · · 6.50^{+0.74}_{−1.08} · · · HFF6P-0954-7261 40.039781 −1.623927 1.39 ± 0.25 −0.09 ± 0.11 27.29 ± 0.09 · · · 6.11^{+0.70}_{−0.70} · · · HFF6P-1339-7197 40.055809 −1.622150 1.74 ± 0.46 0.01 ± 0.12 27.39 ± 0.10 · · · 6.29^{+0.71}_{−0.71} · · · HFF6P-1619-8043 40.067498 −1.634549 1.61 ± 0.49 0.20 ± 0.13 27.42 ± 0.10 · · · 6.20^{+0.71}_{−0.71} · · · HFF6P-1406-8067 40.058588 −1.635205 > 1.95 −0.10 ± 0.12 27.43 ± 0.10 · · · 6.43^{+0.73}_{−0.73} · · · HFF6P-1120-6563 40.046698 −1.615649 > 1.69 0.19 ± 0.14 27.47 ± 0.11 · · · 6.28^{+0.76}_{−0.71} · · · HFF6P-1404-6507 40.058514 −1.614092 1.12 ± 0.25 −0.09 ± 0.14 27.52 ± 0.12 · · · 5.94^{+0.68}_{−0.68} · · · HFF6P-1111-8294 40.046301 −1.641520 1.34 ± 0.29 −0.14 ± 0.14 27.53 ± 0.12 · · · 6.05^{+0.69}_{−0.69} · · · HFF6P-1650-7475 40.068770 −1.629867 1.36 ± 0.38 −0.16 ± 0.16 27.75 ± 0.14 · · · 6.09^{+0.70}_{−0.70} · · · HFF6P-0940-7273 40.039181 −1.624272 1.52 ± 0.35 −0.33 ± 0.16 27.76 ± 0.14 · · · 6.14^{+0.70}_{−0.70} · · · HFF6P-1631-7409 40.067987 −1.628035 1.55 ± 0.48 −0.12 ± 0.17 27.77 ± 0.14 · · · 6.16^{+0.70}_{−0.70} · · · HFF6P-1513-6504 40.063047 −1.614000 1.15 ± 0.33 −0.09 ± 0.17 27.78 ± 0.15 · · · 5.89^{+0.68}_{−0.68} · · · HFF6P-1282-8053 40.053420 −1.634833 0.88 ± 0.29 −0.10 ± 0.18 27.87 ± 0.15 · · · 5.79^{+0.67}_{−0.67} · · · HFF6P-0963-7467 40.040146 −1.629650 > 1.51 0.12 ± 0.20 27.89 ± 0.16 · · · 6.48^{+0.73}_{−0.97} · · · HFF6P-1352-6549 40.056353 −1.615251 > 1.13 0.22 ± 0.22 27.95 ± 0.17 · · · 6.00^{+0.86}_{−5.53} · · · HFF6P-1352-8104 40.056373 −1.636246 1.05 ± 0.36 −0.21 ± 0.20 28.00 ± 0.18 · · · 5.68^{+0.65}_{−4.80} · · · HFF6P-1636-7324 40.068190 −1.625671 > 1.36 −0.00 ± 0.21 28.00 ± 0.17 · · · 6.45^{+0.73}_{−0.76} · · · HFF6P-1197-8268 40.049891 −1.640781 > 1.65 −0.22 ± 0.21 28.02 ± 0.19 · · · 6.41^{+0.73}_{−0.73} · · · HFF6P-1485-8415 40.061875 −1.644873 0.88 ± 0.38 −0.04 ± 0.22 28.03 ± 0.18 · · · 5.67^{+0.65}_{−1.66} · · · HFF6P-1346-7336 40.056107 −1.626010 > 1.06 0.18 ± 0.23 28.04 ± 0.18 · · · 6.07^{+0.82}_{−0.81} · · · HFF6P-1534-8390 40.063919 −1.644193 1.09 ± 0.46 −0.05 ± 0.22 28.04 ± 0.18 · · · 5.74^{+0.70}_{−5.48} · · · HFF6P-1105-8129 40.046060 −1.636943 0.98 ± 0.40 −0.01 ± 0.24 28.08 ± 0.20 · · · 5.67^{+0.65}_{−4.66} · · · HFF6P-1437-6560 40.059896 −1.615568 0.91 ± 0.41 −0.08 ± 0.24 28.12 ± 0.20 · · · 5.76^{+0.66}_{−4.85} · · · HFF6P-1197-8275 40.049900 −1.640994 > 1.42 −0.13 ± 0.25 28.16 ± 0.22 · · · 6.21^{+0.71}_{−0.71} · · · HFF6P-1554-7558 40.064752 −1.632167 0.81 ± 0.39 −0.14 ± 0.24 28.20 ± 0.21 · · · 1.17^{+3.86}_{−1.06} · · ·

a Total magnitudes m_{tot} estimated with the aperture correction m_{tot} = m_{AP} − 0.82. b Magnifications calculated with mass models in Kawamata et al. (2017).

c References. (1)Atek et al. (2014), (2)Atek et al. (2015a), (3)Coe et al. (2015), (4)Laporte et al. (2014), (5)Laporte et al. (2015), (6)Laporte

et al. (2016), (7)Livermore et al. (2017), (8)McLeod et al. (2016), (9)Oesch et al. (2015) (10)Zheng et al. (2014), (11)Zitrin et al. (2014)

Table 5 Dropout candidates at z ∼ 8

ID R.A. (J2000) Dec (J2000) Y_{105} − J_{125} J_{125} − JH_{140} JH_{140}^a μ^b Photo-z Reference^c

Abell2744 Cluster HFF1C-2508-2496 3.604518 −30.380467 1.17 ± 0.07 0.04 ± 0.04 25.92 ± 0.03 1.31 8.00^{+0.88}_{−0.88} (1), (2), (3), (4), (10) HFF1C-2481-2561 3.603378 −30.382254 1.27 ± 0.15 0.14 ± 0.08 26.64 ± 0.05 1.40 8.20^{+0.90}_{−0.90} (2), (3), (7), (10) HFF1C-2306-3089 3.596091 −30.385833 1.30 ± 0.16 0.06 ± 0.08 26.68 ± 0.06 2.04 8.18^{+0.90}_{−0.90} (2), (3), (7), (10) HFF1C-2555-2515 3.606461 −30.380996 1.12 ± 0.14 −0.18 ± 0.09 26.95 ± 0.07 1.33 7.96^{+0.88}_{−0.88} (2), (3), (7), (10) HFF1C-2492-2561 3.603859 −30.382263 1.92 ± 0.37 0.16 ± 0.11 26.99 ± 0.07 1.40 8.40^{+0.92}_{−0.92} (2), (3), (7), (8), (10) HFF1C-2557-2513 3.606577 −30.380924 1.10 ± 0.24 0.22 ± 0.13 27.17 ± 0.08 1.32 7.88^{+0.87}_{−6.13} (2), (10) HFF1C-2135-2432 3.588980 −30.378668 1.13 ± 0.19 −0.19 ± 0.13 27.30 ± 0.10 1.69 7.94^{+0.88}_{−0.88} (2), (3), (10) HFF1C-2495-2562 3.603997 −30.382304 1.05 ± 0.32 0.13 ± 0.19 27.61 ± 0.12 1.40 7.90^{+0.87}_{−6.08} (10) HFF1C-2216-4356 3.592349 −30.409892 0.60 ± 0.28 −0.30 ± 0.25 28.01 ± 0.20 8.56 7.22^{+0.81}_{−2.02} (2), (7), (10)

Full-Data Results of Hubble Frontier Fields 19

Table 5 — Continued

ID R.A. (J2000) Dec (J2000) Y_{105} − J_{125} J_{125} − JH_{140} JH_{140}^a μ^b Photo-z Reference^c

HFF1C-2521-2532 3.605062 −30.381463 0.84 ± 0.32 −0.16 ± 0.25 28.07 ± 0.18 1.35 7.67^{+0.85}_{−6.39} (2), (7) Abell2744 Parallel HFF1P-5398-1451 3.474918 −30.362542 0.60 ± 0.12 −0.05 ± 0.11 27.03 ± 0.08 · · · 7.50^{+0.83}_{−1.52} · · · HFF1P-5021-2024 3.459245 −30.367360 0.70 ± 0.20 −0.06 ± 0.17 27.53 ± 0.12 · · · 7.56^{+0.84}_{−1.80} · · · HFF1P-5512-1588 3.479684 −30.366359 0.86 ± 0.36 0.21 ± 0.25 27.81 ± 0.15 · · · 7.76^{+0.86}_{−6.38} · · · HFF1P-5530-3153 3.480419 −30.387608 0.55 ± 0.25 0.08 ± 0.22 27.84 ± 0.15 · · · 7.28^{+0.81}_{−6.27} · · · MACS0416 Cluster HFF2C-1151-4540 64.047984 −24.081670 1.92 ± 0.20 0.01 ± 0.06 26.50 ± 0.04 1.44 8.39^{+0.92}_{−0.92} (3), (5), (8) HFF2C-0939-5354 64.039164 −24.093183 2.19 ± 0.34 0.18 ± 0.08 26.61 ± 0.05 1.38 8.50^{+0.93}_{−0.93} (5), (8) HFF2C-1153-4531 64.048057 −24.081431 2.28 ± 0.56 0.49 ± 0.11 26.80 ± 0.06 1.44 8.67^{+0.95}_{−0.95} (3), (5) HFF2C-0901-5171 64.037567 −24.088109 1.94 ± 0.63 0.12 ± 0.18 27.56 ± 0.12 1.70 8.36^{+0.92}_{−0.92} (5), (7), (8) HFF2C-1447-3538 64.060329 −24.064958 0.86 ± 0.19 −0.31 ± 0.16 27.71 ± 0.12 1.79 7.70^{+0.85}_{−0.85} (7) MACS0416 Parallel HFF2P-2912-7330 64.121367 −24.125856 0.69 ± 0.11 −0.14 ± 0.09 27.07 ± 0.06 · · · 7.62^{+0.84}_{−0.84} · · · HFF2P-3286-6419 64.136930 −24.111643 0.98 ± 0.18 0.13 ± 0.10 27.21 ± 0.06 · · · 7.81^{+0.86}_{−0.86} · · · HFF2P-3596-6480 64.149865 −24.113353 1.74 ± 0.58 0.39 ± 0.17 27.56 ± 0.09 · · · 8.52^{+0.93}_{−0.93} (3), (8) HFF2P-3044-6002 64.126862 −24.100067 1.20 ± 0.27 −0.21 ± 0.16 27.80 ± 0.12 · · · 1.76^{+6.42}_{−0.27} (8) HFF2P-3042-6011 64.126779 −24.100323 1.33 ± 0.43 0.18 ± 0.19 27.81 ± 0.12 · · · 8.19^{+0.90}_{−0.94} (3), (8) HFF2P-3549-6422 64.147904 −24.111729 2.26 ± 0.97 −0.02 ± 0.21 28.02 ± 0.14 · · · 8.35^{+0.92}_{−0.92} · · · HFF2P-2862-7348 64.119271 −24.126357 0.78 ± 0.31 −0.09 ± 0.23 28.07 ± 0.16 · · · 5.74^{+2.19}_{−5.18} · · · HFF2P-3642-6304 64.151758 −24.108450 > 2.04 0.15 ± 0.27 28.13 ± 0.17 · · · 8.61^{+0.94}_{−6.48} (3), (8) HFF2P-2871-7010 64.119662 −24.116955 0.86 ± 0.31 −0.12 ± 0.22 28.14 ± 0.16 · · · 7.69^{+0.85}_{−6.20} · · · MACS0717 Parallel HFF3P-2251-9452 109.343797 37.829234 1.35 ± 0.33 0.21 ± 0.15 27.26 ± 0.10 · · · 8.25^{+0.91}_{−0.91} (6) HFF3P-1788-9254 109.324524 37.823744 1.26 ± 0.27 −0.05 ± 0.15 27.37 ± 0.10 · · · 8.06^{+0.89}_{−0.89} (6) HFF3P-1891-8538 109.328823 37.814951 0.61 ± 0.19 −0.19 ± 0.17 27.62 ± 0.13 · · · 5.51^{+1.66}_{−4.87} (6) HFF3P-1672-0089 109.319676 37.835808 0.54 ± 0.24 −0.01 ± 0.20 27.67 ± 0.14 · · · 7.29^{+0.81}_{−2.23} · · · HFF3P-1854-0446 109.327261 37.845741 0.92 ± 0.33 −0.09 ± 0.24 27.93 ± 0.18 · · · 7.76^{+0.86}_{−2.74} · · · HFF3P-2153-9369 109.339742 37.826923 0.95 ± 0.34 −0.11 ± 0.25 27.95 ± 0.18 · · · 7.76^{+0.86}_{−6.00} (6) MACS1149 Cluster HFF4C-4025-5027 177.417749 22.417435 0.57 ± 0.03 0.02 ± 0.02 25.19 ± 0.02 1.57 7.50^{+0.83}_{−0.83} · · · HFF4C-4024-4492 177.417702 22.413687 1.61 ± 0.50 0.35 ± 0.19 27.26 ± 0.12 1.63 8.42^{+0.92}_{−0.92} · · · MACS1149 Parallel HFF4P-3745-6484 177.406060 22.280113 1.71 ± 0.29 0.36 ± 0.10 26.66 ± 0.06 · · · 8.37^{+0.92}_{−0.92} · · · HFF4P-3998-8560 177.416587 22.315557 1.16 ± 0.15 0.07 ± 0.09 26.85 ± 0.06 · · · 7.96^{+0.88}_{−0.88} · · · HFF4P-3959-8115 177.414974 22.303195 0.63 ± 0.16 −0.00 ± 0.14 27.36 ± 0.09 · · · 7.53^{+0.84}_{−2.07} · · · HFF4P-3612-8473 177.400509 22.313149 0.68 ± 0.19 −0.03 ± 0.16 27.55 ± 0.11 · · · 7.57^{+0.84}_{−6.25} · · · HFF4P-4149-8180 177.422903 22.305006 0.83 ± 0.23 0.02 ± 0.18 27.67 ± 0.12 · · · 7.73^{+0.86}_{−6.66} · · · HFF4P-3769-8456 177.407054 22.312680 0.60 ± 0.20 −0.17 ± 0.19 27.78 ± 0.14 · · · 7.38^{+0.82}_{−1.50} · · · HFF4P-4419-8349 177.434162 22.309708 0.76 ± 0.23 −0.28 ± 0.21 27.98 ± 0.17 · · · 1.71^{+6.08}_{−1.19} · · · HFF4P-3878-7079 177.411594 22.285550 1.02 ± 0.40 0.04 ± 0.25 28.01 ± 0.17 · · · 7.86^{+0.87}_{−6.63} · · · HFF4P-4553-7304 177.439740 22.291792 0.78 ± 0.32 0.02 ± 0.24 28.01 ± 0.17 · · · 7.54^{+0.84}_{−6.48} · · · HFF4P-3593-8440 177.399737 22.312238 0.79 ± 0.28 −0.31 ± 0.25 28.15 ± 0.19 · · · 7.45^{+0.83}_{−6.68} · · · AbellS1063 Cluster HFF5C-4316-1323 342.179848 −44.525661 1.48 ± 0.26 0.08 ± 0.11 26.97 ± 0.08 27.72 8.21^{+0.90}_{−0.90} · · · HFF5C-4374-1338 342.182266 −44.526074 1.88 ± 0.57 0.35 ± 0.16 27.21 ± 0.09 24.75 8.52^{+0.93}_{−0.93} · · · HFF5C-4111-2125 342.171304 −44.536810 0.54 ± 0.23 −0.22 ± 0.22 27.60 ± 0.17 4.10 1.64^{+0.47}_{−1.53} · · · HFF5C-3935-1469 342.163986 −44.529704 1.06 ± 0.41 0.15 ± 0.25 27.89 ± 0.16 5.13 7.92^{+0.87}_{−6.93} · · · AbellS1063 Parallel HFF5P-2129-2064 342.338729 −44.535120 0.56 ± 0.06 0.03 ± 0.05 26.33 ± 0.03 · · · 7.44^{+0.83}_{−0.83} · · · HFF5P-1912-1491 342.329688 −44.530307 0.96 ± 0.10 −0.04 ± 0.07 26.75 ± 0.05 · · · 7.88^{+0.87}_{−0.87} · · · HFF5P-1278-2047 342.303254 −44.534661 1.17 ± 0.45 0.16 ± 0.24 27.85 ± 0.15 · · · 7.98^{+0.88}_{−6.34} · · · HFF5P-2027-2472 342.334489 −44.546470 0.55 ± 0.21 −0.27 ± 0.21 28.07 ± 0.15 · · · 7.21^{+0.81}_{−6.07} · · · HFF5P-1617-1544 342.317413 −44.531796 0.80 ± 0.34 −0.08 ± 0.25 28.19 ± 0.18 · · · 1.75^{+5.27}_{−1.46} · · · HFF5P-1222-3093 342.300944 −44.552588 1.09 ± 0.41 −0.08 ± 0.25 28.20 ± 0.17 · · · 7.88^{+0.87}_{−6.46} · · ·

20 Ishigaki et al.

Table 5 — Continued

ID R.A. (J2000) Dec (J2000) Y_{105} − J_{125} J_{125} − JH_{140} JH_{140}^a μ^b Photo-z Reference^c

Abell370 Cluster HFF6C-5058-4269 39.960762 −1.574159 0.83 ± 0.05 −0.06 ± 0.04 25.62 ± 0.03 8.65 7.78^{+0.86}_{−0.86} · · · HFF6C-5131-4097 39.963821 −1.569362 0.96 ± 0.09 −0.07 ± 0.07 25.99 ± 0.05 8.93 7.88^{+0.87}_{−0.87} · · · HFF6C-5578-4519 39.982425 −1.581097 1.63 ± 0.22 −0.04 ± 0.10 26.49 ± 0.07 8.05 8.23^{+0.90}_{−0.90} · · · HFF6C-5420-5141 39.975874 −1.587261 1.78 ± 0.35 −0.08 ± 0.15 26.93 ± 0.11 4.66 8.22^{+0.90}_{−0.90} · · · HFF6C-4926-4404 39.955279 −1.577912 2.03 ± 0.47 0.02 ± 0.16 26.98 ± 0.11 3.16 8.34^{+0.92}_{−0.92} · · · HFF6C-5187-5411 39.966133 −1.594771 0.61 ± 0.27 0.07 ± 0.24 27.34 ± 0.16 17.57 7.38^{+0.82}_{−5.89} · · · Abell370 Parallel HFF6P-1733-6559 40.072227 −1.615552 0.78 ± 0.23 0.19 ± 0.17 27.49 ± 0.11 · · · 7.58^{+0.84}_{−2.15} · · · HFF6P-1374-7002 40.057265 −1.616732 0.69 ± 0.27 −0.04 ± 0.24 27.97 ± 0.17 · · · 1.64^{+6.17}_{−0.54} · · · HFF6P-1167-6515 40.048638 −1.614306 0.66 ± 0.33 −0.08 ± 0.30 28.25 ± 0.22 · · · 1.77^{+1.36}_{−1.56} · · · a Total magnitudes m_{tot} estimated with the aperture correction m_{tot} = m_{AP} − 0.82. b Magnifications calculated with mass models in Kawamata et al. (2017).

c References. (1)Atek et al. (2014), (2)Atek et al. (2015a), (3)Coe et al. (2015), (4)Laporte et al. (2014), (5)Laporte et al. (2015), (6)Laporte

et al. (2016), (7)Livermore et al. (2017), (8)McLeod et al. (2016), (9)Oesch et al. (2015) (10)Zheng et al. (2014), (11)Zitrin et al. (2014)

Table 6 Dropout candidates at z ∼ 9

ID R.A. (J2000) Dec (J2000) Y J − JH_{140} JH_{140} − H_{160} H_{160}^a μ^b Photo-z Reference^c

Abell2744 Cluster HFF1C-2481-2561 3.603380 −30.382255 0.78 ± 0.08 −0.05 ± 0.07 26.69 ± 0.05 1.40 8.19^{+0.90}_{−0.90} (2), (3), (7), (10) HFF1C-2492-2561 3.603859 −30.382262 1.12 ± 0.11 0.19 ± 0.09 26.79 ± 0.06 1.40 8.40^{+0.92}_{−0.92} (1), (2), (3), (7), (10) HFF1C-2220-4053 3.592512 −30.401486 > 1.21 0.55 ± 0.30 27.38 ± 0.17 14.13 9.54^{+1.03}_{−7.31} (9), (11) Abell2744 Parallel HFF1P-5363-4016 3.473469 −30.400460 0.96 ± 0.18 0.08 ± 0.15 27.44 ± 0.10 · · · 8.30^{+0.91}_{−6.63} · · · HFF1P-5364-3024 3.473522 −30.384024 > 1.34 0.26 ± 0.22 27.77 ± 0.13 · · · 8.73^{+0.95}_{−6.34} (8) HFF1P-5733-3462 3.488893 −30.396183 1.65 ± 0.26 −0.23 ± 0.18 27.77 ± 0.14 · · · 8.72^{+0.95}_{−0.95} (8) HFF1P-5386-2074 3.474445 −30.368728 > 1.80 −0.26 ± 0.27 28.17 ± 0.21 · · · 8.89^{+0.97}_{−6.87} · · · MACS0416 Cluster HFF2C-1151-4540 64.047984 −24.081671 0.97 ± 0.06 0.00 ± 0.06 26.50 ± 0.04 1.44 8.39^{+0.92}_{−0.92} (3), (5), (8) HFF2C-0939-5354 64.039161 −24.093184 1.27 ± 0.08 0.06 ± 0.07 26.55 ± 0.05 1.39 8.51^{+0.93}_{−0.93} (5), (8) HFF2C-0901-5172 64.037566 −24.088113 1.06 ± 0.18 −0.25 ± 0.20 27.82 ± 0.15 1.70 8.34^{+0.92}_{−0.92} (5), (7), (8) MACS0416 Parallel HFF2P-3441-6014 64.143391 −24.100397 1.00 ± 0.22 0.15 ± 0.13 27.43 ± 0.09 · · · 2.12^{+6.06}_{−0.54} · · · HFF2P-3596-6480 64.149865 −24.113352 1.26 ± 0.17 0.03 ± 0.13 27.53 ± 0.09 · · · 8.51^{+0.93}_{−0.93} (3), (8) HFF2P-3549-6422 64.147905 −24.111729 1.11 ± 0.21 0.18 ± 0.19 27.84 ± 0.13 · · · 8.35^{+0.92}_{−0.92} · · · HFF2P-3042-6011 64.126779 −24.100325 0.84 ± 0.19 −0.16 ± 0.19 27.97 ± 0.14 · · · 8.19^{+0.90}_{−0.92} (3), (8) HFF2P-3172-6467 64.132190 −24.112994 > 1.45 0.04 ± 0.22 28.08 ± 0.15 · · · 8.84^{+0.96}_{−2.06} (8) HFF2P-3736-6107 64.155668 −24.102997 1.29 ± 0.35 −0.27 ± 0.22 28.15 ± 0.18 · · · 8.55^{+0.94}_{−6.81} · · · MACS0717 Parallel HFF3P-2251-9452 109.343799 37.829235 0.89 ± 0.15 −0.27 ± 0.16 27.53 ± 0.13 · · · 8.25^{+0.91}_{−0.91} (6) HFF3P-1821-9546 109.325904 37.831848 1.03 ± 0.33 0.14 ± 0.18 27.54 ± 0.12 · · · 2.17^{+6.27}_{−0.64} · · · HFF3P-1762-9402 109.323423 37.827843 1.00 ± 0.29 −0.26 ± 0.23 27.94 ± 0.18 · · · 7.57^{+1.11}_{−6.11} (6) MACS1149 Cluster HFF4C-3358-4457 177.389950 22.412710 > 2.39 0.19 ± 0.05 25.80 ± 0.03 17.53 9.21^{+1.00}_{−1.00} (8) HFF4C-4024-4492 177.417700 22.413691 1.11 ± 0.19 −0.15 ± 0.17 27.44 ± 0.12 1.63 8.40^{+0.92}_{−0.92} · · · HFF4C-3373-4483 177.390553 22.413417 > 1.30 0.15 ± 0.29 27.75 ± 0.17 63.86 8.65^{+0.95}_{−6.85} (8) HFF4C-3617-3327 177.400727 22.392425 > 1.28 −0.17 ± 0.30 27.89 ± 0.22 35.36 8.45^{+0.93}_{−6.17} · · · MACS1149 Parallel HFF4P-3745-6484 177.406057 22.280112 1.22 ± 0.10 0.21 ± 0.07 26.44 ± 0.05 · · · 8.36^{+0.92}_{−0.92} · · · HFF4P-3994-7367 177.416441 22.293541 > 1.98 0.02 ± 0.14 27.33 ± 0.09 · · · 9.20^{+1.00}_{−1.00} (8) HFF4P-4205-8351 177.425216 22.309763 1.19 ± 0.39 −0.00 ± 0.31 28.28 ± 0.22 · · · 2.13^{+7.20}_{−0.81} · · · AbellS1063 Cluster

Full-Data Results of Hubble Frontier Fields 21

Table 6 — Continued

ID R.A. (J2000) Dec (J2000) Y J − JH_{140} JH_{140} − H_{160} H_{160}^a μ^b Photo-z Reference^c

HFF5C-4316-1323 342.179874 −44.525660 0.78 ± 0.12 −0.03 ± 0.12 27.07 ± 0.08 29.58 8.15^{+0.90}_{−0.90} · · · HFF5C-4374-1338 342.182264 −44.526074 1.29 ± 0.16 −0.13 ± 0.14 27.34 ± 0.11 24.15 8.52^{+0.93}_{−0.93} · · · AbellS1063 Parallel HFF5P-1975-2112 342.332299 −44.536446 1.05 ± 0.23 0.21 ± 0.16 27.47 ± 0.10 · · · 2.13^{+6.51}_{−0.45} · · · HFF5P-2042-2369 342.335117 −44.543602 0.94 ± 0.36 0.17 ± 0.30 28.20 ± 0.20 · · · 8.29^{+1.01}_{−6.63} · · · HFF5P-2092-3100 342.337186 −44.552795 > 0.94 0.00 ± 0.32 28.42 ± 0.24 · · · 8.19^{+0.90}_{−2.43} · · · Abell370 Cluster HFF6C-5578-4519 39.982427 −1.581097 0.78 ± 0.10 0.04 ± 0.10 26.45 ± 0.06 8.26 8.23^{+0.90}_{−0.90} · · · HFF6C-5421-5141 39.975875 −1.587260 0.81 ± 0.15 −0.07 ± 0.15 27.01 ± 0.10 4.55 8.23^{+0.90}_{−0.90} · · · Abell370 Parallel HFF6P-1732-6562 40.072207 −1.615618 0.85 ± 0.17 0.03 ± 0.15 27.43 ± 0.10 · · · 8.14^{+0.90}_{−1.41} · · · HFF6P-1247-6578 40.051970 −1.616066 0.82 ± 0.25 0.08 ± 0.17 27.60 ± 0.11 · · · 2.05^{+5.75}_{−0.73} · · · HFF6P-1350-7372 40.056259 −1.627015 1.14 ± 0.36 0.22 ± 0.21 27.69 ± 0.12 · · · 8.33^{+1.18}_{−6.56} · · · HFF6P-1194-8213 40.049783 −1.639252 > 1.83 −0.17 ± 0.19 27.81 ± 0.13 · · · 8.89^{+0.97}_{−0.97} · · · HFF6P-1311-7372 40.054627 −1.627015 1.24 ± 0.30 −0.05 ± 0.24 28.02 ± 0.17 · · · 8.49^{+0.93}_{−6.68} · · · HFF6P-1293-6262 40.053900 −1.607296 > 1.83 −0.19 ± 0.22 28.03 ± 0.16 · · · 8.90^{+0.97}_{−6.47} · · · HFF6P-1514-7171 40.063097 −1.621433 1.46 ± 0.67 −0.15 ± 0.28 28.29 ± 0.20 · · · 8.61^{+1.10}_{−7.00} · · ·

a Total magnitudes m_{tot} estimated with the aperture correction m_{tot} = m_{AP} − 0.82. b Magnifications calculated with mass models in Kawamata et al. (2017).

c References. (1)Atek et al. (2014), (2)Atek et al. (2015a), (3)Coe et al. (2015), (4)Laporte et al. (2014), (5)Laporte et al. (2015), (6)Laporte et al. (2016), (7)Livermore et al. (2017), (8)McLeod et al. (2016), (9)Oesch et al. (2015) (10)Zheng et al. (2014), (11)Zitrin et al. (2014)