arXiv:1611.03283v1 [astro-ph.SR] 10 Nov 2016

Astronomy & Astrophysics manuscript no. OH˙UV˙giants˙v6 © ESO 2018 September 7, 2018

Three-dimensional hydrodynamical CO^5BOLD model atmospheres of red giant stars

V. Oxygen abundance in the metal-poor giant HD 122563 from OH UV lines

D. Prakapavičius^1 , A. Kučinskas^{1,2}, V. Dobrovolskas^1 , J. Klevas^1, M. Steffen^{3,4}, P. Bonifacio^4, H.-G. Ludwig^{4,5}, and M. Spite^4

1 Institute of Theoretical Physics and Astronomy, Vilnius University, Saulėtekio al. 5, Vilnius LT-10221, Lithuania e-mail: dainius.prakapavicius@tfai.vu.lt 2 Astronomical Observatory, Vilnius University, M. K. Čiurlionio 29, Vilnius LT-03100, Lithuania 3 Leibniz-Institut für Astrophysik Potsdam, An der Sternwarte 16, D-14482 Potsdam, Germany 4 GEPI, Observatoire de Paris, CNRS, Université Paris Diderot, Place Jules Janssen, 92190 Meudon, France 5 Landessternwarte – Zentrum für Astronomie der Universität Heidelberg, Königstuhl 12, D-69117 Heidelberg, Germany

Received XXX; accepted XXX

ABSTRACT

Context. Although oxygen is an important tracer of the early Galactic evolution, its abundance trends with metallicity are still relatively poorly known at [Fe/H] ≲ −2.5. This is in part due to a lack of reliable oxygen abundance indicators in the metal-poor stars, in part due to shortcomings in 1D LTE abundance analyses where different abundance indicators, such as OH lines located in the UV and IR or the forbidden [O I] line at 630 nm, frequently provide inconsistent results.

Aims. In this study we determined the oxygen abundance in the metal-poor halo giant HD 122563 using a 3D hydrodynamical CO^5BOLD model atmosphere. Our main goal was to understand whether a 3D LTE analysis may help to improve the reliability of oxygen abundances determined from OH UV lines in comparison to those obtained using standard 1D LTE methodology. Methods. The oxygen abundance in HD 122563 was determined using 71 OH UV lines located in the wavelength range between 308 − 330 nm. The analysis was done using a high-resolution VLT UVES spectrum with a 1D LTE spectral line synthesis performed using the SYNTHE package and classical ATLAS9 model atmosphere. Subsequently, a 3D hydrodynamical CO^5BOLD, and 1D hydrostatic LHD model atmospheres were used in order to compute 3D–1D abundance corrections. For this, the microturbulence velocity used with the 1D LHD model atmosphere was derived from the hydrodynamical CO^5BOLD model atmosphere of HD 122563. The obtained abundance corrections were then applied to determine 3D LTE oxygen abundances from each individual OH UV line. Results. As in previous studies, we found trends of the 1D LTE oxygen abundances determined from OH UV lines with line parameters, such as the line excitation potential, χ, and the line equivalent width, W. These trends become significantly less pronounced in 3D LTE. Using OH UV lines we determined a 3D LTE oxygen abundance in HD 122563 of A(O)_{3D LTE} = 6.23 ± 0.13 ([O/Fe] = 0.07 ± 0.13). This is in fair agreement with the oxygen abundance obtained from OH IR lines, A(O)_{3D LTE} = 6.39 ± 0.11 ([O/Fe] = 0.23 ± 0.11), but it is noticeably lower than that determined using the forbidden [O i] line, A(O)_{3D LTE} = 6.53 ± 0.15 ([O/Fe] = 0.37 ± 0.15). While the exact cause for this discrepancy remains unclear, it is very likely that non-LTE effects may play a decisive role here. Oxygen-to-iron ratios determined in HD 122563 using OH UV/IR lines and the forbidden [O i] line fall on the lower boundary of the [O/Fe] distribution observed in the Galactic field stars at this metallicity and suggest a very mild oxygen overabundance with respect to iron, [O/Fe] ≲ 0.4.

Key words. Stars: Population II – Stars: late type – Stars: atmospheres – Stars: abundances – Techniques: spectroscopic – Convection – Hydrodynamics

1. Introduction

Oxygen is an important tracer of the chemical evolution of stellar populations. During the early stages of the formation of the Galaxy, oxygen was synthesized in massive stars and released into the interstellar medium on timescales of 10^6 − 10^7 years. Since the amount of oxygen produced in a given stellar population depends on the details of its star formation history (such as initial mass function and star formation rate), the knowledge of the oxygen abundance in the oldest (i.e., metal-poor) Galactic stars may allow us to put stricter constraints on the possible scenarios of early Galactic evolution.

Measurements of the oxygen abundance in metal-poor stars are difficult, for several reasons. First, only a few spectral lines of atomic oxygen are available for oxygen diagnostics in metalpoor ([Fe/H] < −2) stars: the forbidden [O i] 630 nm line in giants, and the permitted O i 777 nm triplet in main sequence stars and subgiants. Therefore, different spectral lines are used to study different types of stars. Besides, all atomic oxygen lines become very weak at these low metallicities - and thus difficult to measure. Because of these reasons, OH vibrational-rotational and pure rotational lines in the infrared (∼ 1500 − 2100 nm) and electronic lines in the ultraviolet (∼ 310−330 nm) are often used to probe the oxygen abundance in metal-poor stars. However, oxygen abundances obtained from OH lines typically show large line-to-line scatter and/or trends with the line equivalent width and/or excitation potential (see, e.g., Meléndez & Barbuy 2002; Barbuy et al. 2003; Aoki 2015). Finally, oxygen abundances ob-

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

tained using different indicators are frequently inconsistent. For example, abundances determined using OH lines may be up to ∼ 0.4 dex higher than those obtained using the [O i] line (see, e.g., Dobrovolskas et al. 2015, and references therein). All these factors lead to large systematic uncertainties in the derived oxygen abundances. As a consequence, our current knowledge about the oxygen trends at low metallicities is still incomplete: some authors claim that the [O/Fe] ratio increases towards the lowest metallicities and reaches [O/Fe] ≈ 1.0 at [Fe/H] ≈ −3 (e.g., Israelian et al. 2001), while others find that there is a plateau around [O/Fe] ≈ 0.4 − 0.7 at [Fe/H] ≈ −2 . . . − 3 (e.g., Cayrel et al. 2004; Amarsi et al. 2015).

It is possible that inconsistencies in the oxygen abundances obtained using different spectral indicators are partly caused by insufficient physical realism of the classical abundance analysis techniques which rely on 1D hydrostatic model atmospheres. It is well known that oxygen lines are sensitive to 3D hydrodynamical effects, such as convection and/or shock waves (e.g., Collet et al. 2007; Kučinskas et al. 2013; Dobrovolskas et al. 2013). However, these effects are not properly taken into account with the classical approach. Although the influence of 3D hydrodynamical effects on the spectral line strengths is different for different lines and depends on the structure of a given stellar atmosphere (which, in turn, is defined by the atmospheric parameters of a given star), 3D–1D differences in the oxygen abundances can reach or even exceed ∼ 0.4 dex (Collet et al. 2007; Dobrovolskas et al. 2013). Such differences are similar in their size to the discrepancies in oxygen abundances obtained using different indicators described above and therefore may point to inadequacies in 1D model atmospheres as a possible culprit^1.

In Dobrovolskas et al. (2015) we therefore investigated whether 3D hydrodynamical model atmospheres may help to solve these problems. In that study we determined 3D LTE oxygen abundances in four metal-poor red giants using infrared (IR) vibrational-rotational OH lines. We found that in the 3D LTE analysis the difference between the average oxygen abundances obtained in the four metal-poor giants using OH IR lines and [O i] 630 nm line was 0.09 dex, down from 0.34 dex determined in 1D LTE^2. Unfortunately, it is still unclear whether similar improvements could be expected in case of OH lines that are located in the ultraviolet (UV) part of the spectrum. To our knowledge, the only studies where OH UV lines were investigated using 3D hydrodynamical model atmospheres were carried out by Asplund & García Pérez (2001), who focused on dwarfs, González Hernández et al. (2010); Behara et al. (2010) where the authors targeted a sample of metal poor subgiant stars; and by Bessell et al. (2015) who studied the extremely metalpoor halo subgiant SMSS J031300.36-670839.3 (though the atmospheric parameters of this star, T_{eff} = 5125 K and log g = 2.3, are in fact more similar to those of a giant) and Collet et al. (2006), who analysed a giant and a dwarf. Other studies of red giant stars are still lacking.

In the present paper we therefore extend our previous work and focus on OH UV lines which we use to determine 1D LTE and 3D LTE oxygen abundances in the well-studied metal-poor giant HD 122563. The main goals of this work are: (a) to better

1 Although non-local thermodynamic equilibrium (NLTE) effects may play an important role here too, their study is beyond the scope of the present work.

2 It is known that the forbidden [O i] line is insensitive to 3D hydrodynamical and NLTE effects, therefore oxygen abundances determined using this line offer a convenient reference point (see, e.g., Dobrovolskas et al. 2015, and references therein).

understand the role of 3D hydrodynamical effects/convection in the formation of OH UV lines in the atmospheres of metal-poor red giant stars; (b) to find out whether the analysis of OH UV lines with 3D hydrodynamical model atmospheres may provide oxygen abundances that are more precise and reliable than those obtainable in 1D LTE analysis; and (c) to determine whether the use of 3D hydrodynamical model atmospheres may help to reconcile abundances determined using OH UV, OH IR, and [O i] lines. Therefore, ultimately, we aim to provide a prescription for future studies of oxygen abundances based on 3D LTE analysis of OH UV lines that, besides of being stronger and more numerous than atomic oxygen lines, frequently can be the only available indicators of oxygen abundance in the metal-poor red giants.

The paper is structured as follows: Our target object, i.e., the metal-poor red giant HD 122563, the spectroscopic material, the 1D hydrostatic and 3D hydrodynamical model atmospheres, and the 1D and 3D abundance analysis techniques are described in Sect. 2. The obtained results are presented and discussed in Sect. 3, while the main findings and conclusions are summarized in Sect 4.

2. Methodology

In order to determine oxygen abundances in the metal-poor red giant HD 122563 from OH UV lines, we used classical 1D hydrostatic and 3D hydrodynamical model atmospheres together with 1D LTE and 3D LTE spectral synthesis techniques. In what follows below we briefly describe our motivation for selecting HD 122563 as the target for this pilot study, our choice of spectroscopic observational material, the model atmospheres and spectral synthesis techniques, and the methodology that we used to determine 1D LTE and 3D LTE oxygen abundances and their uncertainties in HD 122563.

2.1. Target object: HD 122563

In this work we focus on a well-studied metal-poor red giant HD 122563. This bright (V = 6.2) halo star has been thoroughly investigated in a number of studies and has reliably determined atmospheric parameters, as well as abundant high quality spectroscopic observations. All this makes HD 122563 a suitable target for the study of OH UV line formation in the atmospheres of metal-poor red giant stars.

After assessing available determinations of the atmospheric parameters of HD 122563, we have chosen to use T_{eff} = 4600 K and log g = 1.60, as determined using precise interferometric measurements by Creevey et al. (2012). The metallicity, [Fe/H] = −2.60, was adopted from Mashonkina et al. (2011). This result was obtained using 1D NLTE abundance analysis techniques and the model atmosphere characterized by the atmospheric parameters identical to those used in our study (more recently Jofré et al. 2014 has obtained a similar value of [Fe/H] = −2.64 which was determined in a careful 1D NLTE analysis of Fe i and Fe ii lines in HD 122563).

2.2. The observed spectrum of HD 122563

We used a high-resolution (R = 60 000) spectrum of HD 122563 that was obtained with the UVES spectrograph mounted on the ESO VLT UT2 telescope. A reduced spectrum was taken from the ESO UVES Paranal Observatory Project (UVES-POP) archive (program ID 266.D-5655; Bagnulo et al. 2003). The

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Table 1. Atmospheric parameters of the model atmospheres used in this work. In case of the 3D model atmosphere temporal RMS of the T_{eff} is also noted.

Model T_{eff} log g [Fe/H] atmosphere K [cgs] dex ATLAS9 (1D) 4600 1.6 −2.60 LHD (1D) 4600 1.6 −2.50 CO^5BOLD(3D) 4597 ± 7 1.6 −2.50

UVES-POP spectrum of HD 122563 was obtained using both the blue and red arm of the spectrograph, and covered a total spectral range of 304 − 1040 nm. In our study we focused only on the UV part of the spectrum where OH UV lines used for the oxygen abundance analysis were located, i.e., the region between 308 − 330 nm. In the observed spectrum the continuum S/N ratio in this wavelength range varied from ∼ 55@310 nm to ∼ 195@330 nm (see Appendix B for details related to the determination of S/N).

2.3. Model atmospheres

Three types of model atmospheres were used in this work:

• a 1D hydrostatic ATLAS9 model atmosphere; • a 1D hydrostatic model atmosphere computed using the LHD code (Caffau et al. 2008);

• a 3D hydrodynamic model atmosphere computed with the CO^5BOLD package (Freytag et al. 2012).

Both 1D model atmospheres were identical to those used in Dobrovolskas et al. (2015) while our 3D model atmosphere had the same atmospheric parameters but was more extended in the vertical direction than the one used in Dobrovolskas et al. (2015, see below). The atmospheric parameters of the model atmospheres are listed in Table 1.

The three model atmospheres were computed having slightly different purposes in mind. The classical ATLAS9 model atmosphere was used to determine oxygen abundances from the OH UV lines in the observed spectrum of HD 122563 (see Sect. 2.4.1). The model atmosphere was computed using the Linux port of the ATLAS9 code (Sbordone et al. 2004; Sbordone 2005). Model computations were done with the overshooting switched off and the mixing length parameter set to α_{MLT} = 1.25. The radiative transfer included continuum scattering and was solved by adopting NEWODF opacity distribution functions (ODFs) that were computed with metallicity [Fe/H] = −2.5 and microturbulence velocity of ξ = 2 km s^{−1} (Castelli et al. 2003).

The 1D hydrostatic LHD and 3D hydrodynamical CO^5BOLD model atmospheres were used for computing 3D–1D LTE abundance corrections which were further used to determine 3D LTE oxygen abundances (see Sect. 2.4.2). The abundance corrections were also used to assess the influence of convection on the formation of OH UV lines (Sect. 3). The LHD and CO^5BOLD model atmospheres were computed using identical atmospheric parameters, chemical composition, equation of state, opacities, and radiative transfer scheme. Our goal therefore was to minimize the differences between the LHD and CO^5BOLD models so that the role of convection in the OH UV line formation could be assessed by comparing the differences in the atmospheric structures and observable properties of the two model atmospheres (see Sect. 3)^3.

3 Such differential approach has been used in our earlier studies as well; see, e.g., Dobrovolskas et al. (2013), Kučinskas et al. (2013), Dobrovolskas et al. (2015), for more details on this methodology.

Fig. 1. Top: temperature structure of the 3D hydrodynamical (grey scale map of the logarithmic temperature probability density), average ⟨3D⟩ (blue dashed line), and 1D LHD (green dotted line) model atmospheres of HD 122563. For comparison, we also show the temperature profile of the ATLAS9 model atmosphere (red solid line). Horizontal bars indicate the optical depth intervals where 90% of the equivalent width (i.e., between 5% and 95%) of three representative OH lines is formed in the 3D hydrodynamical (black solid bar), average ⟨3D⟩ (blue dashed bar), and 1D LHD (green dotted bar) model atmospheres (spectral line parameters are given next to each set of horizontal bars). Bottom: RMS value of horizontal temperature fluctuations in the 3D model (black solid line, ΔT_{RMS}), temperature difference

between the average ⟨3D⟩ and 1D models, � T^4_{3D}

�_{1/4} − T_{LHD} (blue dashed line), and temperature difference between the ATLAS9 and LHD model atmospheres (red solid line).

We stress that ATLAS9 model atmospheres are better suited for 1D LTE abundance analysis than LHD models, because of the more realistic radiative transfer scheme based on opacity distribution functions. On the other hand, LHD models are better suited for assessing the influence of convection on the spectral line formation and by computing 3D–1D abundance corrections, because LHD and CO^5BOLD model atmospheres are computed employing identical radiative transfer schemes and microphysics.

The 3D hydrodynamical CO^5BOLD simulations were performed following the procedures described in our earlier studies (see, e.g., Ludwig & Kučinskas 2012; Kučinskas et al. 2013; Dobrovolskas et al. 2013). The model atmosphere was computed using a “box-in-a-star“ setup and Cartesian grid of 160 × 160 × 300 points (3.85 × 3.85 × 3.78 Gm) in x × y × z, respectively (z denotes the vertical direction). The radiative transfer was solved under the assumption of LTE, scattering was treated as true absorption. MARCS opacities were grouped into six bins following the methodology described in Nordlund (1982); Ludwig et al. (1994); Vögler et al. (2004). The model atmosphere was computed using solar-scaled chemical composition,

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

with the α-element abundances enhanced by [α/Fe] = +0.4 dex (see Dobrovolskas et al. 2013, for details). The simulation box covered the Rosseland optical depth range of −11 ≲ log τ_{Ross} ≲ 9. Our 3D model atmosphere was more extended than the one used in Dobrovolskas et al. (2015) which had the outer boundary set at log τ_{Ross} ≈ −6.5. The larger vertical extension in our case was needed to accommodate the formation of strong OH UV lines since in the most extreme cases it was extending to log τ_{Ross} ≈ −7 (one of such extreme examples is shown in Fig. 6, left panel; see Sect. 3.2 for details).

The CO^5BOLD model simulation run covered a span of ∼ 10 convective turn-over times as measured by the Brunt-Vaiasälä timescale (see Ludwig & Kučinskas 2012, for details). For further analysis, we have selected a sub-sample of 20 representative snapshots (i.e., 3D model structures computed at different instants in time). The snapshots were chosen by ensuring that the average thermodynamic and hydrodynamical properties of the 20-snapshot sub-sample and those of the entire simulation run would be as similar as possible (see Ludwig & Kučinskas 2012, for details).

As in our previous work, we also used an average ⟨3D⟩ CO^5BOLD model atmosphere. It was obtained by averaging the fourth moment of temperature on surfaces of equal Rosseland optical depth in the 20-snapshot sub-sample. This model atmosphere was used to evaluate the influence of temperature fluctuations on the formation of OH UV lines (see Sect. 2.4.2 below).

The 1D hydrostatic LHD model atmosphere was computed using the LHD model atmosphere package, by utilizing the same atmospheric parameters, equation of state, opacities, and chemical composition as used in the computation of the 3D hydrodynamical CO^5BOLD model atmosphere. This was dictated by the choice of metallicities at which MARCS opacities used in the CO^5BOLD/LHD simulation runs were available. This issue is discussed further in Sect. 3 but, in fact, such choice had negligible implications on the results of oxygen abundance analysis. The convective energy transport in the LHD model was treated using mixing-length theory, with a mixing-length parameter of α_{MLT} = 1.0.

Temperature profiles of the 3D hydrodynamical, average ⟨3D⟩, and 1D model atmospheres used in this work are shown in Fig. 1.

2.4. Measurements of oxygen abundance in HD 122563 from OH UV lines

The oxygen abundance determination in HD 122563 was carried out in several steps. First, 1D LTE oxygen abundances were determined from the individual OH UV lines in the observed spectrum of HD 122563, by using the ATLAS9 model atmosphere and synthetic line profiles computed with the SYNTHE package (Sect. 2.4.1). Next, we used the Linfor3D spectral synthesis package together with the LHD and CO^5BOLD model atmospheres to compute 1D LTE and 3D LTE curves of growth (COGs) for each OH UV line. The COGs were used to determine 3D–1D abundance corrections, Δ_{3D LTE−1D LTE} (Sect. 2.4.2). Finally, the 3D LTE abundances were computed by adding 3D–1D abundance corrections to the 1D LTE oxygen abundances determined using individual OH UV lines. The details of these procedures are summarized in the sections below.

2.4.1. Determination of 1D LTE oxygen abundances

We determined 1D LTE oxygen abundances by fitting theoretical line profiles to OH UV lines in the observed UVES spectrum of HD 122563.

The list of OH UV lines used in our analysis is provided in the Table A.1. When selecting lines for the abundance analysis we tried to make sure that they are sufficiently strong (but not saturated) and free from severe blends, so that a reliable determination of oxygen abundances was possible. Nevertheless, nearly all lines in the list are blended, some of them strongly. Therefore, we divided them into three categories according to their quality:

• A-class lines: strong and weakly blended: 3 lines; • B-class lines: strong and moderately blended: 23 lines; • C-class lines: weak or significantly blended with lines of other chemical species: 45 lines.

Obviously, the most reliable oxygen abundances were determined using lines of classes A and B which constitute ∼35% of all lines used in the abundance analysis.

Since the spectral region of interest is severely affected by strong line blends, it makes it difficult to choose an accurate continuum level in the observed spectrum of HD 122563. We therefore determined the continuum interactively, by comparing the observed spectrum with the synthetic 1D LTE spectrum computed using the SYNTHE spectral synthesis package, and seeking the best match. Obviously, the lack of accuracy of the continuum placement had an impact on the derived oxygen abundances; this issue is further discussed in Sect 2.4.3.

Theoretical profiles of OH UV lines were computed with the SYNTHE package in the implementation of Sbordone et al. (2004); Sbordone (2005), using the 1D ATLAS9 model atmosphere of HD 122563 computed as described in Sect 2.3. The SYNTHE calculations included a proper treatment of continuum scattering. For the majority of OH UV lines, atomic line parameters were taken from Aoki (2015). Additionally, we also used data from Israelian et al. (1998), García Pérez et al. (2006), and Kurucz line lists (see Table A.1). The Kurucz atomic and molecular line lists (Castelli & Kurucz 2004) were used for computing spectral line profiles of all other chemical species. In the spectral synthesis computations we used a depth-independent microturbulence velocity of ξ_{mic} = 2.0 km/s taken from Spite et al. (2005). Abundances of chemical elements other than oxygen were not determined in our analysis, despite the fact that lines of these elements were sometimes blending with OH UV lines. Instead, we used a solar-scaled chemical composition with constant [α/Fe] = +0.4 enhancement in the abundances of all αelements, in accordance with the results of Barbuy et al. (2003). All synthetic line profiles were convolved with a Gaussian profile characterized by the broadening velocity, v_{brd}, which accounted for the cumulative effect of macroturbulence, stellar rotation, and instrumental broadening.

Apart from the atomic parameters that were different for each OH UV line (line wavelength, oscillator strength, line excitation potential) and those parameters that were identical for all lines (e.g., microturbulence velocity), synthetic 1D LTE profiles of individual OH UV lines were shaped by two variables – the oxygen abundance, A(O), and broadening velocity, v_{brd}. These parameters had to be determined simultaneously, by fitting theoretical to the observed line profiles. During the fitting procedure, we also determined an arbitrary wavelength shift between the observed and synthetic spectra, Δλ, in order to compensate for various wavelength-related shifts (e.g., those caused by wavelength calibration errors, imprecise spectral line wave-

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. 2. Typical fits of synthetic line profiles to OH UV lines in the observed spectrum of HD 122563. The observed lines belong to different quality classes, as indicated above each panel (see Sect. 2.4.1for details). Black crosses show the observed spectrum, red lines are best-fitting synthetic spectra selected using a globally fixed v_{brd}. Shaded areas mark the fitting regions that were selected individually for each OH UV line.

lengths, convective wavelength shifts). All three fitting parameters – Δλ, v_{brd}, and A(O) – were determined by minimizing χ^2 residuals between the observed and synthetic line profiles (see below). For this, we computed a grid of synthetic 1D LTE OH UV line profiles which covered a range in oxygen abundances and line broadening velocities of 5.60 < A(O) < 6.80 and 5.5 < v_{brd} < 11.0 km/s in steps of 0.1 dex and 0.5 km/s, respectively. Tests made with finer grids have shown that the spacing of our grid was sufficient to limit the error in the oxygen abundance due to the finite step size to ∼0.005 dex. This is because during the fitting procedure our grid was further interpolated to obtain better precision in the determined abundances (see below).

During the fitting of the theoretical to the observed line profiles we therefore first determined Δλ, v_{brd}, and A(O). This was done by comparing synthetic and observed fluxes, F_{syn} and F_{obs}, respectively, for each individual line in our OH UV line list. The wavelength interval for the fitting of F_{obs} and F_{syn} was tailored specifically in case of each OH UV line, in order to avoid blends, neighbouring lines of other elements, artefacts (see Fig. 2 and Sect. 3.1 below). Then, for each spectral line i we used a number of trial values of Δλ^j and for each wavelength point m in the line profile i and each value of v_{brd}^k and A(O)^l in our grid of synthetic line profiles we computed an array of χ^2 values according to

χ^2_i (Δλ^j, v_{brd}^k, A(O)^l) =

N^i�

m=1 (F_{obs}^m − F_{syn}^{m, j,k,l})^2

σ^2_m (1) where

σ_m =

F_{obs}^m S/N (2) is the uncertainty in the observed flux and S/N is the signal-to-noise ratio in the continuum (Sect. 2.2). Further, this array of χ^2 estimates was quadratically interpolated in the j, k, l− space to obtain better precision in the determined Δλ^i, v_{brd}^i, and A(O)^i. The latter three values were determined individually for each OH UV line, by finding a minimum in the array of χ^2 estimates in the j, k, l− space. The best-fitting synthetic line profiles obtained in this step were used to compute the line equivalent widths of each OH UV line, W_i, which were used further in the determination of 3D–1D abundance corrections and 3D LTE oxygen abundances (Sect. 2.4.2). Note, however, that oxygen abundances determined in this step, A(O)^i, were used solely for the estimation of W_i and excluded from further analysis. We also add that the individual Δλ^i values are consistent with a single radial velocity within ±1 km/s.

In the last step, the χ^2_i estimates were summed up over all i spectral lines to find the global best-fitting broadening velocity, v_{brd}^{1D}. We then used this fixed value of v_{brd}^{1D}, together with the individual estimates of Δλ^i for each OH UV line, and recomputed χ^2 values again, with the only fitting parameter now being the oxygen abundance, A(O)^i. A search for the minimum in the array of these new χ^2_i estimates yielded the final 1D LTE oxygen abundances as derived from each oxygen line, A(O)^i_{1D LTE}. Therefore, our final 1D LTE oxygen abundances were determined using a fixed value of v_{brd} with all OH UV lines. In fact, these abundances were very similar to those obtained using individual values of v_{brd}, i.e., as determined in the previous step above; the largest difference between the estimates obtained using the two methods would rarely exceed ≈ 0.05 dex and typically would be below ≈ 0.01 dex.

The final 1D LTE oxygen abundance estimates obtained from each OH UV line, A(O)^i_{1D LTE}, are listed in the Table A.1. Typical fits of OH UV lines obtained during the last step in the χ^2 minimization procedure are shown in Fig. 2.

2.4.2. Determination of 3D LTE oxygen abundances using 3D–1D abundance corrections

As in Dobrovolskas et al. (2015), 3D LTE oxygen abundances were determined using 3D–1D LTE abundance corrections, Δ_{3D−1D}^4. To determine the abundance corrections, for each individual OH UV line, we utilized COGs that were constructed using the 3D hydrodynamical CO^5BOLD and 1D hydrostatic LHD model atmospheres. Since the OH UV lines are strong (equivalent widths of the strongest lines reach ≈ 13 pm), they are influenced by microturbulent broadening. It was therefore critical to select a correct value of the microturbulent velocity to be used in the computations of 1D LTE COGs with the 1D LHD model atmospheres. We approached this problem in the following way.

4 The 3D–1D abundance correction, Δ_{3D−1D}, is defined as difference in the oxygen abundance, A(O), determined using the same spectral line of a given equivalent width, W, with the 3D hydrodynamical and 1D hydrostatic model atmospheres (see, e.g., Kučinskas et al. 2013; Dobrovolskas et al. 2015, for details).

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. 3. Microturbulence velocities derived from individual OH UV lines using the 3D hydrodynamical CO^5BOLD model atmosphere.

Our first step was to determine ξ_{mic} that would result from the 3D hydrodynamical CO^5BOLD model atmosphere of HD 122563. This was done by utilizing Method 1 from Steffen et al. (2013). In short, we selected 15 OH UV lines that covered the range of excitation potentials 0 < χ < 2 eV. For each of these lines, we computed 3D LTE COGs using the CO^5BOLD model atmosphere with the original (hydrodynamic) velocity field. Subsequently, the velocity field in the CO^5BOLD model was replaced by a depthindependent and isotropic ξ_{mic}. We then utilized this modified model atmosphere to compute a number of COGs using various values of ξ_{mic}. For each OH UV line we then picked the value of ξ_{mic} which replicated the line equivalent width, W_i, determined using the original CO^5BOLD model atmosphere. Fig. 3 shows the resulting ξ_{mic} obtained using this approach for each of the 15 OH UV lines.

It is obvious from Fig. 3 that ξ_{mic} derived in this way is significantly lower than 2 km/s that was determined in the 1D NLTE analysis by Mashonkina et al. (2011) based on iron lines. This might be partly due to the deficiencies of the 3D model atmosphere (e.g., insufficient spatial resolution, issues with artificial viscosity, and so forth; see Steffen et al. 2013, for a detailed discussion). However, as we show in Appendix C, such a procedure for selecting the microturbulent velocity allows to compensate for the inadequacies in the 3D model atmosphere, in effect yielding nearly identical 3D–1D abundance corrections irrespective of ξ_{mic} used to obtain 1D LTE oxygen abundances. Therefore, for the computation of 1D LHD and ⟨3D⟩ COGs – which were further used to compute 3D–1D abundance corrections (see below) – we used the average ξ_{mic} = 1.30 km/s. The uncertainty of this estimate is ±0.11 km/s which is a standard deviation of line-to-line variation of the determined ξ_{mic}.

Spectral line synthesis computations involved in the determination of 3D–1D abundance corrections were performed with the Linfor3D package^5. In this step we used the W_i that were determined in the first sweep of the line profile fitting (Sect. 2.4.1). Abundance corrections were then obtained by measuring the difference in the oxygen abundance between the two COGs at a given value of W_i. Finally, 3D LTE oxygen abundances, A(O)^i_{3D LTE}, were determined by adding the 3D–1D abundance corrections to the 1D LTE abundances, A(O)^i_{1D LTE}, obtained from the individual OH UV lines using ATLAS9 model

5 http://www.aip.de/Members/msteffen/linfor3d atmospheres (Sect. 2.4.1). The 3D–1D abundance corrections, Δ_{3D−1D}, together with 3D LTE oxygen abundances obtained from the individual OH UV lines, A(O)^i_{3D LTE}, are provided in Table A.1.

It is also important to note that the carbon-to-oxygen ratio plays an important role in governing the formation of OH molecules in stellar atmospheres. When oxygen dominates over carbon, the latter is almost entirely locked in CO and only the excess of oxygen is available for the formation of other oxygen-bearing molecules, including OH (see, e.g., Dobrovolskas et al. 2013). According to the 1D LTE analysis performed by Spite et al. (2005), the carbon-to-oxygen ratio in HD 122563 is C/O ≈ 0.05. Thus, oxygen is the majority (dominant) species in the formation of CO molecules. Even if in principle a 3D analysis may yield a C/O ratio that is slightly different from the one obtained by Spite et al. (2005), i.e., because of different 3D–1D abundance corrections for oxygen and carbon, this (supposedly, small) change in the carbon abundance should not have a noticeable effect on the strengths of the OH lines (Dobrovolskas et al. 2013, their Appendix C). Indeed, the tests that we did to verify this assumption have confirmed that changing the C/O ratio by ±0.05 dex did not alter the 3D–1D oxygen abundance corrections by more than ∼ 0.01 dex (see Appendix D for test results and extended discussion)^6.

We also note that in the Linfor3D calculations we treated scattering as true absorption. The effects of continuum scattering on the 3D-1D abundance corrections of OH UV lines were investigated in Hayek et al. (2011, see their figures 18 and 19), but for hotter model atmospheres characterized by higher surface gravities. The authors found that the treatment of scattering might alter the 3D–1D abundance corrections by 0.05–0.1 dex at the model metallicity of HD 122563. However, the authors used 1D MARCS model atmospheres for reference, which does not warrant a differential comparison. Since we use LHD model atmospheres for reference, we expect the effect of scattering to be smaller with respect to the results of Hayek et al. (2011). A deeper investigation of the effects of continuum scattering on OH UV lines is however beyond the scope of the current work.

For each OH UV line we also produced COGs that were constructed using the average ⟨3D⟩ model atmosphere. These COGs, together with those produced with the 3D hydrodynamical and 1D hydrostatic model atmospheres, were used to compute two additional abundance corrections, Δ_{3D−⟨3D⟩} and Δ_{⟨3D⟩−1D}. Since the ⟨3D⟩ model atmosphere is one-dimensional and is devoid of information about the horizontal inhomogeneities of thermodynamic and hydrodynamical quantities, the Δ_{3D−⟨3D⟩} correction may be used to estimate the role of horizontal fluctuations in the line formation. Similarly, the Δ_{⟨3D⟩−1D} correction measures the role of differences between ⟨3D⟩ and 1D model atmospheres.

2.4.3. Error budget

Four factors contribute to the uncertainty of the oxygen abundances determined from individual OH lines:

• formal fitting errors;

• errors in the atmospheric parameters; • errors in the continuum placement;

6 Note, however, that the situation is entirely different when C/O ≳ 1: in this case even small changes in the carbon abundance have a dramatic effect on the strength of OH lines. As it has been recently demonstrated by Gallagher et al. (2016), that in such situations the carbon and oxygen abundance should be determined in 3D simultaneously.

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

• errors in equivalent width measurements.

In case of each individual OH UV line, the formal fitting error, σ_χ2 , was computed by evaluating the difference in A(O)^i_{1D LTE} that satisfied the condition χ^2 − χ^2_{min} = 1, with the oxygen abundances determined using a fixed value of v_{brd} for all lines (Sect. 2.4.1).

Creevey et al. (2012) quotes errors on the determined T_{eff} and log g to be 41 K and 0.04 dex, respectively. We therefore computed four additional ATLAS9 model atmospheres with T_{eff} and log g shifted from the values listed in Table 1 by ±41 K and ±0.04 dex, respectively. The differences between the oxygen abundances obtained from each OH UV line with these model atmospheres and those determined in Sect. 2.4.1 yielded errors due to uncertainties in the atmospheric parameters, σ_{ΔTeff} and σ_{Δlog g}.

According to Spite et al. (2005), the error in ξ_{mic} is 0.2 km/s. In order to evaluate the uncertainties in the oxygen abundances due to the imprecise determination of ξ_{mic}, we have repeated the spectral synthesis computations with SYNTHE for each OH UV line, using ξ_{mic} = 1.8 and 2.2 km/s. A subsequent abundance determination using these new theoretical line profiles and comparison of the obtained abundances with those determined in Sect. 2.4.1 provided errors due to the uncertainty in ξ_{mic}, σ^{1D}_{vmic}. For most lines, this error was very small and only in rare cases exceeded 0.1 dex.

As noted in Sect. 2.4.2, for the calculation of Δ_{3D−1D}, we used ξ_{mic} = 1.30 ± 0.11 km/s. In order to estimate the error due to the uncertainty in the determined value of ξ_{mic}, we carried out 1D LTE line synthesis computations using the Linfor3D package and LHD model atmosphere, again with ξ_{mic} = 1.41 and 1.19 km/s. The obtained COGs were used to determine abundance corrections Δ_{3D−1D} and, subsequently, 3D LTE oxygen abundances. Comparison of these 3D LTE abundances with those determined in Sect. 2.4.2, provided us with the error on the 3D LTE abundances, σ^{3D}_{vmic}. Again, these errors were very small and typically well below 0.03 dex.

To estimate the error in the oxygen abundance due to the uncertainty in the continuum placement, we used a wavelengthdependent error σ_{flux}(λ) ≡ (S/N)^{−1} that was determined as described in Appendix B. The observed spectrum was scaled by dividing it by 1.0 ± σ_{flux}(λ). We then repeated the 1D LTE abundance determination with the scaled observed spectrum (following the prescription given in Sect. 2.4.1) and determined σ_{cont} by comparing the obtained result with that determined in Sect. 2.4.1.

The final source of uncertainty stems from the imprecise measurements of W_i. As discussed in Sect. 2.4.2, W_i measurements were used solely for the estimation of the 3D–1D abundance corrections and hence they impact only A(O)^i_{3D LTE}. We assumed that the uncertainty on W_i was 5%, a rather conservative estimate. Using this error, we recomputed the Δ_{3D−1D} abundance corrections and found that the resulting influence on A(O)^i_{3D LTE} never exceeded 0.025 dex and typically was below 0.01 dex. Practically, this means that other sources of uncertainty dominated over the error due to uncertainty in W_i.

The final errors in oxygen abundances as determined from each OH UV line were computed as a square root of the sum of relevant errors in quadratures and are given in Table A.1.

Table 2. 1D and 3D abundances of OH UV and IR and [O i] lines in HD 122563. Oxygen abundances determined using IR lines are from Dobrovolskas et al. (2015), while those determined using the [O i] line was taken from Spite et al. (2005)

A(O) [O/Fe] 1D LTE 3D LTE 1D LTE 3D LTE OH UV 6.41 ± 0.16 6.23 ± 0.13 0.25 ± 0.16 0.07 ± 0.13 OH IR 6.63 ± 0.10 6.39 ± 0.11 0.47 ± 0.10 0.23 ± 0.11 [O i] 6.54 ± 0.15 6.53 ± 0.15 0.38 ± 0.15 0.37 ± 0.15

3. Results and discussion

3.1. 1D LTE and 3D LTE oxygen abundance in HD 122563

The 1D LTE oxygen abundances obtained from individual OH UV lines are plotted against the line excitation potential, equivalent width, and central wavelength in Fig. 4 (left panels). The weighted least squares fitting of 1D LTE abundances yielded a slope dA(O)_{1D LTE}/dχ = −0.25 ± 0.03 dex/eV. This result is very similar to the one derived by Aoki (2015), who has analysed the extremely metal-poor subgiant star BD+44^∘493 and derived dA(O)_{1D LTE}/dχ = −0.23 ± 0.03 dex/eV. Applying the Student’s t-test to our data, the null hypothesis that the slope between abundance and χ is zero can be rejected at a posteriori significance level α = 0.01%.

These results demonstrate that 1D LTE oxygen abundance depends on these line parameters indicating systematic errors in the modelling. For example, the negative slope in the A(O)^i_{1D LTE} − χ plane may indicate that the model atmosphere is too hot, whereas accurate flux measurements (Creevey et al. 2012) and non-LTE analysis of iron lines (Mashonkina et al. 2011) suggest that this is not the case. The lowest quality lines (class C) typically show a larger line-to-line scatter of the oxygen abundances. The trends, however, are seen in cases of both best (classes A–B) and lower (class C) quality lines. Similar results have been obtained earlier by other authors who also noticed that the oxygen abundance determined from OH lines either in the UV or IR showed trends with the line parameters, such as excitation potential and/or line equivalent width (e.g., Meléndez & Barbuy 2002; Aoki 2015; Dobrovolskas et al. 2015)^7.

The situation looks significantly better when 3D LTE oxygen abundances are used instead (Fig. 4, right panels). The trends now virtually vanish, with dA(O)_{3D LTE}/dχ = 0.00±0.04 dex/eV. This is confirmed by the Student’s t-test which yields a a posteriori significance level α = 15% computed using our data. This large number gives a clear indication that the rejection of the null hypothesis is not warranted. In this context it is interesting to note that Dobrovolskas et al. (2015) have also applied 3D–1D abundance corrections to their 1D LTE oxygen abundances determined from OH IR lines in four-metal poor giants, including HD 122563. In their case, however, this procedure did not help to entirely remove the trends seen in the A(O)^i_{1D LTE} −χ plane, although one may also argue that the number of OH IR lines used in their study was small and thus it was difficult to judge whether these trends were statistically significant in the first place.

For comparison, we collected 1D LTE and 3D LTE oxygen abundances determined in HD 122563 using OH UV/IR lines (this work and Dobrovolskas et al. 2015) and the forbid-

7 Trends seen in the different panels of Fig. 4 are not entirely independent. For example, lines with the highest excitation potential are also the weakest, thus negative slope seen in the A(O)^i_{1D LTE} − χ plane translates into the opposite trend seen in the A(O)^i_{1D LTE} − W_i plane.

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. 4. Oxygen abundances determined from the individual OH UV lines using a classical 1D (ATLAS9, left column) and corrected for 3D hydrodynamical effects using a CO^5BOLD model atmosphere (right column). The top, middle, and bottom panels show A(O) plotted versus excitation potential, χ, line equivalent width, W_i, and wavelength, λ, respectively. Different symbols mark spectral lines of different quality where A-class lines are the best/cleanest (see Sect. 2.4.1 for details). All derived abundances are provided in Appendix A.

den [O i] line (literature data) in Table 2 (in case of OH UV/IR lines we provide abundances that are weighted averages of measurements from individual lines; the RMS error given in Table 2 measures the spread in individual abundances). One may conclude that there is a fair agreement between the 3D LTE oxygen abundances obtained using OH UV and IR lines. On the other hand, there is a noticeable difference between the 3D LTE oxygen abundance determined from OH UV lines and that obtained from the forbidden [O i] line. It is possible that these differences may point to the importance of non-LTE effects in the formation of OH lines which were not properly taken into account in our study of OH UV/IR lines. Indeed, OH UV/IR lines form in the outer atmosphere where, for example, overdissociation due to the non-local UV radiation field may lead to smaller number densities of OH molecules (i.e., with respect to those expected in LTE), and thus, to slightly weaker lines in 3D NLTE than those in 3D LTE (see discussion in Asplund & García Pérez 2001). This would result in less negative 3D–1D abundance corrections and, consequently, to higher oxygen abundances obtained from OH lines – which would bring them into better agreement with

Table 3. Line parameters, equivalent widths and abundance corrections – Δ_{3D−1D}, Δ_{3D−⟨3D⟩} Δ_{⟨3D⟩−1D} – of the OH UV lines shown in Fig. 6.

λ χ W_i Δ_{3D−1D} Δ_{3D−⟨3D⟩} Δ_{⟨3D⟩−1D} nm eV pm dex dex dex 310.123 0.067 12.9 -0.43 -0.76 0.33 322.337 1.016 7.88 -0.14 -0.43 0.29 329.126 1.488 1.32 -0.04 -0.18 0.14

those obtained from the forbidden [O i] line. Moreover, the 3D non-LTE effects may also influence the slope in the A(O)^i_{3D LTE} vs. χ plane, as the size of these effects may be different for lines forming at different optical depths in the atmosphere (see, e.g., the 3D non-LTE study of iron line formation by Amarsi et al. 2016). However, a detailed investigation of this problem is beyond the scope of the present study.

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. 5. The 3D–1D abundance corrections as computed for individual OH UV lines: Δ_{3D−1D} (top panels), Δ_{3D−⟨3D⟩} (middle panels), and Δ_{⟨3D⟩−1D} (bottom panels) plotted versus the line excitation potential, χ (left), and line equivalent width, W (right). Red dots mark all OH UV lines in our sample, half-filled black circles represent lines whose contribution functions are shown in Fig. 6 (see text for details). Δ_{⟨3D⟩−1D} values are provided in Appendix A.

Fig. 6. Normalized 3D, ⟨3D⟩ and 1D contribution functions to equivalent width for the three OH UV lines marked in Fig. 5. The parameters of these spectral lines sample the entire range of χ and W_i values of OH UV lines used in our work. See Table 3 and text for details.

3.2. OH UV line formation

To better understand the OH UV line formation in the 3D hydrodynamical and 1D hydrostatic model atmospheres we focus on the abundance corrections Δ_{3D−1D} and their components – Δ_{3D−⟨3D⟩} and Δ_{⟨3D⟩−1D} (Fig. 5). It is evident that the Δ_{3D−1D} correction depends on both χ and W_i. This is in contrast with the findings of Dobrovolskas et al. (2015) for OH IR lines where no such dependence has been found. In our case, the Δ_{3D−1D} corrections are negative for low excitation lines but then progressively approach 0.0 dex for higher excitation lines. The plot also indicates that the Δ_{3D−1D} corrections tend to decrease with W_i. Such behaviour is not unexpected since in our OH UV line sample line strength anti-correlates with the line excitation potential, i.e., lines with lower χ values are stronger (see Appendix E). We have not found any significant relation between the abundance corrections and line wavelength though. This, again, is plausible as the wavelength region where the OH UV lines are located is rather narrow and thus the continuum opacity (as well as line formation depth) is similar for all OH UV lines.

The trends seen in Fig. 5 are caused by an interplay between several factors (see Appendix E for details):

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

– lines with the lowest excitation potentials are on average strongest. Their formation therefore extends farthest into the outer atmosphere where temperature fluctuations are largest (cf. Fig. 6 and 1, where in Fig. 6 we show contribution functions^8 of three different OH UV lines characterized by different χ and W_i; line parameters are summarized in Table 3). This leads to stronger lines in 3D and, thus, to largest and negative Δ_{3D−⟨3D⟩} abundance corrections. Since with increasing χ (and thus decreasing W_i) the outer boundary of the line formation region slowly shifts to higher optical depths, the influence of temperature fluctuations becomes less important there and thus Δ_{3D−⟨3D⟩} corrections gradually decrease in their magnitude;

– on the other hand, while the difference between the average ⟨3D⟩ and 1D temperature profiles is small and varies little over the line formation region, there is a systematic difference in the temperature gradient in the continuum forming layers in the two model atmospheres (around log τ_{Ross} ≈ 0, see Fig. 1). This not only leads to differences in the radiative continuum flux in the UV produced by the ⟨3D⟩ and 1D model atmosphere, respectively, but also translates into different slopes of the linear parts of the respective COGs. Obviously, the abundance corrections derived from two curves of growth characterised by different slopes must be proportional to the line strength, thus explaining the very tight correlations between the Δ_{⟨3D⟩−1D} correction and W_i.

One may therefore conclude that the complex dependence of the total abundance correction, Δ_{3D−1D}, on both χ and W_i is mostly due to the fact that OH UV lines used in our study cover a wide range both in χ and W_i. This also explains why the Δ_{3D−1D} abundance corrections were largely independent of χ in Dobrovolskas et al. (2015). All OH IR used in the latter study were very weak and thus formed at similar optical depths which resulted in similar abundance corrections for all lines.

3.3. Early galactic evolution of oxygen: 3D LTE oxygen abundances from OH UV/IR lines

The mean [O/Fe] ratios determined in HD 122563 using OH UV/IR lines and the forbidden [O i] line are summarized in Table 2. To compute these [O/Fe] ratios we used the 1D NLTE estimate of [Fe/H] = −2.60 from Mashonkina et al. (2011) and the recently determined 3D NLTE solar oxygen abundance of A(O)_⊙ = 8.76 from Steffen et al. (2015)^9. In the context of our study, it would be preferable to account for the 3D and non-LTE effects on the estimate of [Fe/H], too. However, this would require a full 3D NLTE study of iron abundance because, as shown by Klevas et al. (2016), simply adding 3D–1D abundance corrections to the 1D NLTE abundance estimates may lead to inconsistent results. Such analysis is certainly beyond the scope of the present study.

[O/Fe] values determined in HD 122563 using OH UV (this work) and OH IR lines (Dobrovolskas et al. 2015) suggest a mean (unweighted) value of [O/Fe] = 0.16 ± 0.12. Oxygen abundance estimate obtained by Spite et al. (2005) using the forbidden [O i] line yields [O/Fe] = 0.37 ± 0.15. Although, the oxygen-to-iron abundance ratios obtained from UV and IR

8 Contribution function of a given spectral line is defined here as dW/d log τ_{Ross} and thus measures the rate at which line equivalent width grows at any given optical depth (see, e.g., Magain 1986) 9 If the 3D NLTE Solar oxygen abundance of A(O)_⊙ = 8.66 determined by Asplund (2005) were used instead, the [O/Fe] ratios listed in Table 2 would increase by +0.1 dex

Fig. 7. Oxygen-to-iron ratios in the Galactic metal-poor stars (following Fig. 4 from Dobrovolskas et al. 2015). Solid grey circles depict [O/Fe] ratios in red giants, subgiants, and main sequence stars determined using the forbidden [O i] 630 nm line (literature data; see Dobrovolskas et al. 2015, for details). Red triangles show 3D LTE and 1D LTE [O/Fe] ratios in four metalpoor giants obtained from OH IR lines by Dobrovolskas et al. (2015, open and filled symbols, respectively). The [O/Fe] ratios determined in these stars from [O i] line are marked as black solid circles. Blue triangles are average [O/Fe] ratios in HD 122563 obtained in this study from 71 OH UV lines (for readability, abundances determined from OH UV and IR lines are shifted horizontally by ±0.03 dex). The solid line is the evolutionary model of François et al. (2004). Note that all abundance ratios are given in the reference scale where the solar oxygen abundance is A(O) = 8.76 (Steffen et al. 2015).

lines are somewhat different, none of the values support the high over-abundance of oxygen in the early Galaxy, as argued by, e.g., Israelian et al. (2001). On the other hand, the two values are noticeably lower than the typical oxygen-to-iron abundance ratio that would be expected for the Galactic field stars at this metallicity, as seen in Fig. 7. This picture is also supported by the results of González Hernández et al. (2010) and Amarsi et al. (2015) who used 3D hydrodynamical model atmospheres to derive 3D LTE/NLTE oxygen abundances in a sample of Galactic subgiant and/or dwarf stars; the latter authors determined [O/Fe] ≈ 0.4 − 0.6 at the metallicity of HD 122563. Obviously, it would be premature to draw any firm conclusions based on the analysis of a single star. Nevertheless, it seems that the oxygen abundance in HD 122563 loosely fits the scenario proposed by François et al. (2004), albeit on the lower boundary of the oxygen-to-iron ratios observed at this metallicity.

4. Conclusions

In this study we determined the abundance of oxygen in the atmosphere of the metal-poor late-type giant HD 122563 using 71 OH UV lines located in the wavelength range of 308–330 nm. Our analysis was carried out by fitting synthetic 1D LTE line profiles computed using a ATLAS9 model atmosphere and the SYNTHE spectral synthesis package to the OH UV line profiles

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

in the observed high-resolution UVES spectrum of HD 122563. The fitting procedure was done using a χ^2 minimization technique. We then utilized 3D hydrodynamical CO^5BOLD and 1D hydrostatic LHD model atmospheres in order to compute 3D–1D abundance corrections which were subsequently used to determine 3D LTE oxygen abundances. The average 3D LTE oxygen abundance obtained in HD 122563 from 71 OH UV lines is A(O)_{3D LTE} = 6.23 ± 0.13. Based on this value, we further computed an oxygen-to-iron ratio for which we used [Fe/H] = −2.60 from Mashonkina et al. (2011) and a Solar oxygen abundance of A(O)_⊙ = 8.76 determined by Steffen et al. (2015) using a CO^5BOLD model atmosphere and 3D NLTE spectrum synthesis techniques. This yielded [O/Fe] = 0.07 ± 0.13 as determined from OH UV lines in HD 122563.

Our 1D LTE analysis has revealed that oxygen abundances obtained from OH UV lines were clearly dependent on the spectral line parameters, such as excitation potential, χ, and line equivalent width, W. Additionally, 1D LTE abundances determined from OH UV and OH IR lines failed to agree and showed differences of up to ≈ 0.3 dex. Besides, the two abundance estimates did not agree with the one determined using the forbidden [O i] line which is known to be insensitive to 3D hydrodynamical and NLTE effects (see, however, Dupree et al. 2016). These results are in line with the findings of other authors who have encountered similar problems in 1D LTE oxygen abundance analyses based on OH UV/IR lines (e.g., Barbuy et al. 2003; Aoki 2015).

This situation has improved significantly when 1D LTE abundances were corrected for the 3D-related effects which was done by applying 3D–1D abundance corrections. Such procedure has helped to minimize significantly the trends of the oxygen abundance with the spectral line parameters as seen in the results of 1D analysis. This indicates that 3D hydrodynamical effects are indeed important in the formation of OH UV lines in the metal-poor red giant atmospheres and therefore should be properly taken into account in oxygen abundance analysis based on OH UV/IR lines. On the other hand, 3D LTE oxygen abundance obtained in HD 122563 using OH UV lines, [O/Fe] = 0.07±0.13, was found to be lower than that determined using the forbidden [O i] line, [O/Fe] = 0.37 ± 0.15 (although both values are consistent at the 1σ level). While the exact cause for this discrepancy remains unclear, it may be at least partly caused by the non-LTE effects on OH lines which are known to be important in the outer atmospheres of the metal-poor stars, such as HD 122563, but which were not taken into account in the present study.

The mean (unweighted) oxygen-to-iron ratio determined in HD 122563 using OH UV (this study) and OH IR lines (Dobrovolskas et al. 2015), [O/Fe] = 0.16 ± 0.12, as well as one estimate obtained by Spite et al. (2005) using the forbidden [O i] line, [O/Fe] = 0.37 ± 0.15, do not seem to support the high over-abundance of oxygen in the metal-poor stars. In fact, it seems that the oxygen abundance in HD 122563 falls on the lower boundary of the oxygen-to-iron ratio distribution observed in Galactic field stars at this metallicity. Our results obtained from the study of OH UV/IR lines therefore suggest that oxygen overabundance higher than [O/Fe] ≈ 1.0 seems to be unlikely in the metal poor giants at −3.0 < [Fe/H] < −2.5. It is clear, however, that analyses of larger samples of metal-poor giants carried out with 3D hydrodynamical model atmospheres would be very desirable in order to acquire a better understanding of the evolution of oxygen in the early Galaxy.

Acknowledgements. This work was supported by grant from the Research Council of Lithuania (MIP-089/2015). HGL acknowledges financial support by

Sonderforschungsbereich SFB 881 ”The Milky Way System” (subproject A4) of the German Research Foundation (DFG). A part of computations were performed at the High Performance Computing Center, HPC Sauletekis, of the Faculty of Physics, Vilnius University. All plots in this paper were prepared using free Gnuplot software. Results presented in this paper are based on observations collected at the European Organisation for Astronomical Research in the Southern Hemisphere under ESO programme 266.D-5655. We also thank the anonymous referee for the comments that have helped to improve the paper.

References

Alexeeva, S. A., & Mashonkina, L. I. 2015, MNRAS, 453, 1619 Amarsi, A. M., Asplund, M., Collet, R., & Leenaarts, J. 2015, MNRAS, 454, L11 Amarsi, A. M., Lind, K., Asplund, M., Barklem, P. S., & Collet, R. 2016, MNRAS, 463, 1518–1533 Aoki, W. 2015, ApJ, 811, 64 Asplund, M. 2005, ARA&A, 43, 481 Asplund, M., & García Pérez, A. E. 2001, A&A, 372, 601 Bagnulo, S., Jehin, E., Ledoux, C., Cabanac, R., Melo, C. , et al. 2003, Messenger, 114, 10 Barbuy, B., Meléndez, J., Spite, M., et al. 2003, ApJ, 588, 1072 Behara, N. T., Bonifacio, P., Ludwig, H.-G., et al. 2010, A&A, 513, A72 Bessell, M.S., Collet, R., Keller, S.C., et al. 2015, ApJ, 806, 16 Caffau, E., Ludwig, H.-G., Steffen, M., Ayres, T. R., Bonifacio, P., Cayrel, R., Freytag, B., & Plez, B. 2008, A&A, 488, 1031 Castelli, F. & Kurucz, R. L., 2003, Proceed. of IAU Symp. 210, Modeling of Stellar Atmospheres, eds. N. Piskunov et al., poster A20 on the enclosed CD- ROM Castelli, F., & Kurucz, R. L. 2004, arXiv:astro-ph/0405087 Cayrel, R., Depagne, E., Spite, M., et al. 2004, A&A, 416, 1117 Collet, R., Asplund, M., & Trampedach, R. 2007, A&A, 469, 687 Collet, R., Asplund, M., & Trampedach, R. 2006, ApJ, 644, L121 Creevey, O. L., Thévenin, F., Boyajian, T. S., Kervella, P., Chiavassa, A., et al.

2012, A&A, 545, 17 Dobrovolskas, V., Kučinskas, A., Steffen, M., Ludwig, H.-G., Prakapavičius, D., et al. 2013, A&A, 559, A102 Dobrovolskas, V., Kučinskas, A., Bonifacio, P., et al. 2015, A&A, 576, A128 Dupree, A. K., Avrett, E. H., & Kurucz, R. L. 2016, ApJ, 821, L7 François, P., Matteucci, F., Cayrel, R., Spite, M., Spite, F., & Chiappini, C. 2004, A&A, 421, 613 Freytag, B., Steffen, M., Ludwig, H.-G., et al. 2012, J. Comp. Phys., 231, 919 García Pérez, A. E., Asplund, M., Primas, F., Nissen, P. E., & Gustafsson, B.

2006, A&A, 451, 621 Gallagher, A. J., Caffau, E., Bonifacio, P., et al. 2016, A&A, 593, A48 González Hernández, J. I., Bonifacio, P., Ludwig, H.-G., et al. 2010, A&A, 519, A46 Hayek, W., Asplund, M., Collet, R., & Nordlund, Å. 2011, A&A, 529, A158 Israelian, G., García López, R. J., & Rebolo, R. 1998, ApJ, 507, 805 Israelian, G., Rebolo, R., García L., Ramón J., Bonifacio, P., et al. 2001, ApJ, 551, 833 Jofré, P., Heiter, U., Soubiran, C., et al. 2014, A&A, 564, A133 Klevas, J., Kučinskas, A., Steffen, M. et al. 2016, A&A, 586, A156 Kučinskas, A., Steffen, M., Ludwig, H.-G., Dobrovolskas, V., Ivanauskas, A. et al. 2013, A&A, 549, A14 Ludwig, H.-G., & Kučinskas, A. 2012, A&A, 547, A118 Ludwig, H.-G., Jordan, S., & Steffen, M. 1994, A&A, 284, 105 Magain, P. 1986, A&A, 163, 135 Mashonkina, L., Gehren, T., Shi, J.-R., Korn, A. J., & Grupp, F. 2011, A&A, 528, A87 Meléndez, J., & Barbuy, B. 2002, ApJ, 575, 474 Nordlund, Å. 1982, A&A, 107, 1 Sbordone, L., Bonifacio, P., Castelli, F., & Kurucz, R. L. 2004, Mem. Soc. Astron. Italiana, 5, 93 Sbordone, L. 2005, Mem. Soc. Astron. Italiana, 8, 61 Spite, M., Cayrel, R., Plez, B., Hill, V., Spite, F., et al. 2005, A&A, 430, 655 Steffen, M., Caffau, E., & Ludwig, H.-G. 2013, Memorie della Societa Astronomica Italiana Supplementi, 24, 37 Steffen, M., Prakapavičius, D., Caffau, E., et al. 2015, A&A, 583, A57 Vögler, A., Bruls, J. H. M. J., & Schüssler, M. 2004, A&A, 421, 741

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Appendix A: OH line list and oxygen abundances determined from individual lines

In this Section we provide a list of OH UV lines that were used in the oxygen abundance determination in HD 122563. We also provide oxygen abundances obtained from individual OH UV lines, as well as their errors. All this information is summarized in Table A.1 the contents of which are as follows:

– column 1: line central wavelength; – column 2: line excitation potential; – column 3: log g f value;

– column 4: source of log g f value; – column 5: quality of the line; – column 6: equivalent width;

– column 7: 1D LTE oxygen abundance and its error; – column 8: 3D–1D abundance correction and its error; – column 9: 3D LTE oxygen abundance and its error.

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Table A.1. OH UV line parameters and 1D/3D abundances derived from different spectral lines with 1D and 3D model atmospheres.

λ χ log g f Source Quality W_i A(O)_{1D LTE} Δ_{3D−1D} A(O)_{3D LTE} nm eV pm dex dex dex 308.125 0.762 -1.882 WA C 8.69 6.30±0.12 -0.26±0.05 6.04±0.13 308.489 0.843 -1.874 WA B 8.43 6.44±0.12 -0.22±0.05 6.22±0.13 308.622 0.925 -1.852 WA C 8.52 6.56±0.13 -0.20±0.05 6.36±0.14 308.900 0.928 -1.869 WA C 8.88 6.63±0.15 -0.21±0.06 6.42±0.16 309.086 1.013 -1.850 WA C 8.94 6.69±0.09 -0.19±0.06 6.50±0.11 309.239 0.164 -1.782 WA C 12.5 6.36±0.17 -0.41±0.02 5.95±0.17 309.461 0.134 -1.899 WA C 12.7 6.45±0.14 -0.41±0.02 6.04±0.14 309.554 0.205 -3.121 WA C 6.71 6.56±0.11 -0.29±0.04 6.26±0.12 309.665 0.170 -3.098 WA C 7.55 6.65±0.11 -0.36±0.05 6.29±0.13 310.123 0.067 -2.205 WA B 12.8 6.68±0.11 -0.43±0.04 6.25±0.12 310.435 1.202 -1.868 WA C 6.24 6.40±0.11 -0.07±0.04 6.33±0.12 310.566 0.304 -1.708 WA C 13.2 6.48±0.14 -0.34±0.02 6.14±0.15 310.654 0.095 -2.142 WA C 13.0 6.76±0.09 -0.42±0.04 6.34±0.10 310.785 1.297 -1.858 WA C 6.03 6.46±0.13 -0.05±0.04 6.41±0.14 310.907 0.358 -3.129 RK B 6.78 6.62±0.11 -0.26±0.04 6.36±0.12 311.053 1.300 -1.873 WA C 6.15 6.56±0.13 -0.06±0.04 6.50±0.13 311.307 0.053 -3.274 RK B 7.48 6.60±0.13 -0.38±0.05 6.22±0.15 311.336 0.415 -1.649 WA B 13.0 6.61±0.16 -0.31±0.02 6.30±0.16 311.477 0.474 -1.594 WA C 11.8 6.46±0.15 -0.32±0.03 6.13±0.15 311.507 0.474 -3.170 RK C 4.57 6.56±0.10 -0.13±0.02 6.43±0.10 312.058 0.075 -3.280 RK C 6.76 6.56±0.13 -0.32±0.04 6.24±0.14 312.343 0.730 -2.102 RK C 6.38 6.18±0.13 -0.15±0.04 6.02±0.14 312.394 0.205 -2.003 WA C 11.4 6.45±0.12 -0.42±0.03 6.03±0.12 312.704 0.571 -2.442 WA B 7.42 6.45±0.12 -0.24±0.05 6.21±0.13 312.735 0.735 -2.269 WA B 7.26 6.36±0.13 -0.19±0.05 6.17±0.14 312.806 0.541 -2.511 WA C 8.24 6.60±0.10 -0.28±0.05 6.31±0.12 312.993 1.609 -1.490 RK C 3.91 6.16±0.11 0.01±0.01 6.16±0.11 313.617 0.452 -2.570 WA C 7.18 6.42±0.15 -0.25±0.05 6.17±0.16 313.689 0.299 -1.939 WA C 11.7 6.56±0.12 -0.38±0.03 6.18±0.13 313.770 1.031 -1.954 RK C 6.42 6.34±0.10 -0.10±0.04 6.24±0.11 313.916 0.763 -1.564 WA B 8.75 6.19±0.17 -0.24±0.05 5.95±0.18 314.073 0.304 -1.994 WA C 11.4 6.56±0.13 -0.39±0.04 6.17±0.14 314.191 0.507 -2.186 WA C 8.57 6.37±0.12 -0.30±0.05 6.07±0.13 315.100 0.411 -1.890 WA A 10.9 6.49±0.15 -0.36±0.04 6.13±0.15 315.294 0.465 -2.961 RK B 5.86 6.50±0.12 -0.17±0.03 6.33±0.13 316.482 1.107 -1.267 RK C 8.48 6.15±0.15 -0.14±0.05 6.01±0.16 316.716 1.109 -1.694 GI B 7.37 6.36±0.14 -0.11±0.05 6.25±0.15 316.986 0.838 -1.851 WA B 9.35 6.45±0.14 -0.22±0.05 6.23±0.15 317.299 1.202 -1.526 WA B 7.60 6.19±0.19 -0.10±0.05 6.09±0.20 317.319 0.842 -1.885 WA C 8.50 6.45±0.11 -0.20±0.05 6.25±0.13 317.496 0.898 -1.673 RK C 9.25 6.25±0.14 -0.21±0.05 6.04±0.15 317.530 1.204 -1.545 WA C 8.37 6.46±0.15 -0.12±0.05 6.34±0.17 317.767 0.612 -1.720 RK C 11.0 6.49±0.16 -0.29±0.04 6.20±0.17 318.047 0.961 -1.822 WA B 8.16 6.36±0.14 -0.16±0.05 6.20±0.15 318.806 0.683 -2.182 WA C 6.56 6.15±0.14 -0.15±0.04 6.00±0.15 318.931 1.032 -1.840 WA A 6.04 6.24±0.11 -0.08±0.03 6.15±0.12 319.484 0.762 -1.848 WA C 8.76 6.36±0.15 -0.22±0.05 6.14±0.16 319.910 0.735 -2.209 WA C 7.11 6.36±0.10 -0.17±0.04 6.19±0.12 320.095 0.840 -1.810 WA C 9.64 6.46±0.23 -0.22±0.05 6.24±0.24 320.623 0.786 -2.180 WA B 7.52 6.46±0.12 -0.17±0.05 6.29±0.13 320.651 0.953 -2.387 WA C 5.19 6.51±0.11 -0.07±0.02 6.44±0.12 320.677 1.252 -1.804 WA B 5.79 6.36±0.13 -0.05±0.03 6.31±0.14 321.806 0.897 -2.093 WA B 7.27 6.46±0.11 -0.14±0.04 6.32±0.12 322.336 1.016 -1.828 WA B 7.87 6.46±0.16 -0.14±0.05 6.32±0.17 continued on next page

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

λ χ log g f Source Quality W_i A(O)_{1D LTE} Δ_{3D−1D} A(O)_{3D LTE} nm eV pm dex dex dex 322.644 0.960 -1.927 RK C 6.67 6.23±0.15 -0.11±0.04 6.12±0.15 323.514 1.836 -1.164 RK C 4.22 6.14±0.10 0.02±0.01 6.16±0.10 323.757 1.016 -2.456 RK B 3.74 6.36±0.11 -0.06±0.01 6.30±0.11 323.855 1.031 -2.104 WA C 5.14 6.34±0.13 -0.06±0.02 6.28±0.13 324.144 1.199 -1.803 WA B 6.67 6.36±0.14 -0.07±0.04 6.29±0.15 324.281 1.022 -2.540 RK C 3.79 6.45±0.11 -0.06±0.01 6.39±0.11 324.915 1.059 -2.482 RK C 5.08 6.59±0.13 -0.06±0.02 6.53±0.13 325.259 1.297 -1.807 WA C 5.55 6.36±0.12 -0.05±0.02 6.32±0.13 325.549 1.300 -1.829 WA A 5.34 6.35±0.10 -0.03±0.02 6.32±0.11 326.106 1.788 -1.427 RK C 2.23 5.96±0.14 0.00±0.00 5.96±0.14 326.311 1.146 -2.387 RK C 3.85 6.43±0.11 -0.05±0.01 6.38±0.11 326.665 1.191 -2.296 RK C 3.45 6.35±0.11 -0.04±0.00 6.30±0.11 326.904 1.566 -1.846 RK C 1.95 6.03±0.14 -0.02±0.00 6.00±0.14 327.073 1.195 -2.346 RK B 2.74 6.26±0.15 -0.05±0.00 6.21±0.15 327.420 1.331 -1.810 RK C 4.70 6.24±0.11 -0.03±0.01 6.21±0.11 329.126 1.488 -2.479 RK C 1.31 6.36±0.15 -0.04±0.00 6.32±0.15 329.168 1.612 -1.490 RK C 3.37 6.04±0.11 -0.01±0.00 6.03±0.11 Note: ’source’ column indicates the reference of log gf value.

WA - Aoki (2015), RK - Castelli & Kurucz (2004), GI - Israelian et al. (1998), GP - García Pérez et al. (2006)

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. B.1. Signal-to-noise ratio in the investigated spectral region. The dashed line indicates a linear fit to the data.

Appendix B: Determination of the S/N ratio in the observed spectrum of HD 122563

In Eq. (1), σ_{flux} represents the photon noise, which is the inverse of the S/N ratio. σ_{flux} was estimated as a standard deviation of flux values in a blend-free (continuum) spectral regions. Measurements were done in the whole investigated spectral range and 10-20 wavelength points were used for each measurement of σ_{flux}. The results are shown in Fig. B.1. A rather tight relationship between S/N and λ was found and for further applications it is approximated with a linear fit.

Appendix C: Microturbulence in 3D model atmospheres

We have argued in Sect. 2.4.2 that, in order to perform a strictly differential 3D–1D analysis of strong lines that are sensitive to the microturbulence, 3D–1D abundance corrections have to be computed using ξ_{mic} derived from the corresponding 3D hydrodynamical model atmosphere. In this Appendix we justify our claims.

Table C.1. Spatial characteristics of the model atmospheres of HD 122563 used and respective mean ξ_{mic} values derived in Appendix C.

Spatial Spatial extent Grid points ⟨ξ_{mic}⟩ resolution [Mm] x × y × z km/s Low 4.38^2 × 2.90 160^2 × 200 1.31 ± 0.11 High 4.40^2 × 3.13 375^2 × 330 1.50 ± 0.12

We have used two 3D model atmospheres of different spatial resolution and very similar spatial extent in order to compute ξ_{mic} values using the procedure described in Sect. 2.4.2 (see Table C.1 for a description of the model atmospheres and results). The results are shown in Fig. C.1 (Top). One may note immediately that the high-resolution model atmosphere predicts

Fig. C.1. Top: microturbulence velocities, ξ_{mic}, determined from the model atmospheres that were computed using different spatial resolution. Bottom: 3D–1D abundance corrections computed with the two model atmospheres and different approach to ξ_{mic} (see text and legend for details) .

higher ξ_{mic} values. This is expected since higher spatial resolution allows for the appearance of smaller-scale turbulent eddies (e.g., Steffen et al. 2013). Then, for each of the two models we computed a mean microturbulence velocity by averaging ξ_{mic} values determined using 15 OH UV lines. These two values (cf. Table C.1) of the mean microturbulence velocity were used to compute 3D–1D abundance corrections corresponding to the low- and high-resolution cases (Fig. C.1, Bottom). The obtained results show that, once ξ_{mic} is calibrated with the help of the 3D model atmosphere, the resulting abundance corrections are very similar. This is because in both the low- and high-resolution case ξ_{mic} was adjusted in such a way that the 1D model atmospheres would reproduce the line strengths predicted with the corresponding 3D hydrodynamical model atmosphere as accurately as possible. This, in effect, made the 3D–1D abundance corrections insensitive to both the shortcomings of the 3D hydrodynamical model atmospheres (i.e., spatial resolution in our case) and microturbulence used in the 1D LTE abundance analysis. On the other hand, if the 3D–1D abundance corrections were computed using some fixed value of ξ_{mic} (for example, the one determined in the process of 1D LTE abundance analysis), the abundance corrections obtained using the low- and highresolution 3D hydrodynamical model atmospheres will be different. This is illustrated in Fig. C.1 (Bottom) where we also show 3D–1D abundance corrections computed using the two 3D hydrodynamical model atmospheres and identical ξ_{mic} = 2.0 km/s utilized with the 1D ATLAS9 model atmospheres. Indeed, in this case the differences in the abundance corrections are significant and reach ∼ 0.2 dex.

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. D.1. Dependency of Δ_{3D−1D} of a sample of 14 OH UV lines on C/O ratio. Labels on the right indicate χ/eV and W_i/pm of individual lines.

Appendix D: Importance of the C/O ratio in the 3D spectral synthesis

As recently noted by Gallagher et al. (2016), formation of carbon- and oxygen- bearing molecules are very sensitive to the C/O abundance ratio and abundances of these elements should be determined simultaneously (see also González Hernández et al. 2010). The C/O ratio determines which chemical species – carbon or oxygen – is in minority and which of these chemical species will be locked by the formation of strong CO molecules (see Dobrovolskas et al. 2013, who, in their Appendix C, investigated case where C/O < 1). Moreover, line formation in 3D model atmospheres is expected to be more sensitive to the C/O ratio than that of 1D model atmospheres, hence we cannot expect that the possible errors would cancel in our differential approach.

In case of HD 122563, a 1D-based analysis of (Spite et al. 2005) suggests A(C) = 5.23 and A(O) = 6.54, what results in a very low C/O ≈ 0.05. (Alexeeva & Mashonkina 2015) used LTE analysis of molecular lines and NLTE analysis of atomic lines and derived A(C) = 5.10, which implies even lower C/O ≈ 0.03. Also, such C/O ratio means that oxygen is strongly majority species, variation of A(C) should not influence formation of OH lines and we should be safe with using 1D-based A(C). However, we have carried out tests that strengthen our claims.

Fig. D.1 shows 3D-1D abundance corrections plotted versus C/O ratio for a set of 14 real (i.e. real χ and measured W_i) OH lines. It is seen that when 0.025 < C/O < 0.1 (nearly, 0.6 dex in A(C)) the abundance corrections of most lines vary by less than 0.01 dex. We hence conclude that uncertainties on the C/O ratio does not influence our results in any significant way and 1D-based A(C) could be used without introducing additional uncertainties. We add that this could be expected for the majority of red giant branch stars because such stars have experienced the first dredge-up and had their carbon depleted relative to the initial value.

Fig. E.1. Line excitation potential, χ, of OH UV lines used in our study plotted versus the line equivalent width, W_i.

Appendix E: The influence of 3D hydrodynamical effects on the formation of OH UV lines and 3D–1D oxygen abundance corrections

Before going into the investigation of 3D–1D oxygen abundance corrections, let us first note that there is a relation between the line excitation potential, χ, and line equivalent width, W_i (Fig. E.1). As we will show below, this has a direct influence on the 3D–1D abundance corrections for OH UV lines discussed in Sect. 2.4.2.

Table E.1. Line parameters and abundance corrections – Δ_{3D−1D}, Δ_{3D−⟨3D⟩}, Δ_{⟨3D⟩−1D} – for the four lines displayed in Fig. E.3. These lines are defined by a fictitious W_i that is determined by an approximate linear fit to a χ - W_i relationship in Fig. E.1

λ χ W_i Δ_{3D−1D} Δ_{3D−⟨3D⟩} Δ_{⟨3D⟩−1D} nm eV pm dex dex dex 310.123 0.067 9.71 -0.50 -0.88 0.38 313.618 0.452 8.02 -0.29 -0.62 0.33 322.337 1.016 5.55 -0.07 -0.29 0.22 329.126 1.488 3.49 -0.02 -0.19 0.17

To understand the basic tendencies in the behaviour of 3D– 1D abundance corrections seen in Fig. 5, we computed abundance corrections for spectral lines with variable line excitation potential, χ, and equivalent width, W_i. The relation between χ and W_i was defined in such a way that it would approximately follow the best-fitting line in Fig. E.1. The resulting abundance corrections are shown in Fig. E.2 while the contribution functions for four selected lines are shown in Fig. E.3. These figures together give a clear indication that the relation between χ and W_i in our OH UV line sample plays an important role in defining the 3D–1D abundance corrections. At the lowest excitation potentials lines are strongest and thus their formation reaches the outermost atmospheric layers where temperature and line opacity fluctuations are largest. This leads to large negative Δ_{3D−⟨3D⟩} corrections which are counterweighted to some extent by significant but positive Δ_{⟨3D⟩−1D} abundance corrections. With increasing line excitation potential, lines also become weaker and thus their formation is confined to deeper atmospheric layers where

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. E.3. 3D and 1D contribution function to equivalent width for the four lines that are defined by a linear χ - W_i relationship. See Table E.1 and text for details.

temperature fluctuations are smaller. This leads to smaller (i.e., more positive) Δ_{3D−⟨3D⟩} corrections^{10}. Since the depth of the line formation changes insignificantly with further increasing line excitation potential, the Δ_{3D−⟨3D⟩} correction stops growing with χ and the behaviour of the total abundance correction, Δ_{3D−1D} is governed by the slowly decreasing Δ_{⟨3D⟩−1D} correction.

10 Note that when the line excitation potential is in the range of 0 < χ <∼ 1 eV, the line equivalent widths are equal to ≈ 10 − 5 pm and thus the line strength is sensitive to the velocity field. As shown in Fig. 3, velocity field in the 3D model atmosphere also diminishes with χ which further weakens spectral lines in 3D.

Prakapavičius et al.: Oxygen abundance in giants from UV OH lines

Fig. E.2. The three abundance corrections plotted against excitation potential χ. Abundance corrections were computed at line strength linearly varying with the excitation potential where W_i = 10 pm for lines with χ = 0 eV and W_i = 3 pm for lines with χ = 1.5 eV.