arXiv:1610.09636v2 [astro-ph.SR] 8 Nov 2016

Mon. Not. R. Astron. Soc. 000, 1–13 (2016) Printed 6 May 2019 (MN L^ATEX style file v2.2)

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II: Accretion diagnostic lines.^⋆

J. R. Fairlamb^1† R. D. Oudmaijer^1 I. Mendigutia^1 J. D. Ilee^2 M. E. van den Ancker^3

1School of Physics and Astronomy, EC Stoner Building, University of Leeds, Leeds, LS2 9JT, UK 2 Institute of Astronomy, Madingley Road, Cambridge, CB3 0HA, UK 3European Southern Observatory (ESO), Karl-Schwarzschild -Str. 2, 85748 Garching, Germany

Accepted 2016 October 12. Received 2016 October 10; in original form 2015 October 2

ABSTRACT

The Herbig Ae/Be stars (HAeBes) allow an exploration of the properties of Pre- Main Sequence(PMS) stars above the low-mass range (< 2 M_⊙) and those bordering the high-mass range (> 8 M_⊙). This paper is the second in a series exploring accretion in 91 HAeBes with Very Large Telescope/X-shooter spectra. Equivalent width measurements are carried out on 32 different lines, spanning the UV to NIR, in order to obtain their line luminosities. The line luminosities were compared to accretion luminosities, which were determined directly from measurements of an UV-excess. When detected, emission lines always demonstrate a correlation with the accretion luminosity, regardless of detection frequency. The average relationship between accretion luminosity and line luminosity is found to be L_{acc}∝ L_{line}^{1.16±0.15}. This is in agreement with the findings in Classical T Tauri stars, although the HAeBe relationship is generally steeper, particularly towards the Herbig Be mass range. Since all observed lines display a correlation with the accretion luminosity, all of them can be used as accretion tracers. This has increased the number of accretion diagnostic lines in HAeBes tenfold. However, questions still remain on the physical origin of each line, which may not be due to accretion.

Key words: stars: early-type – stars: variables: Herbig Ae/Be – stars: pre-main sequence – stars: formation – accretion, accretion discs – techniques: spectroscopic.

1 INTRODUCTION

Herbig Ae/Be stars, HAeBes, bridge an important mass range between high and low mass stars; namely the intermediate masses of 2–8 M⊙. The HAeBes are pre-main sequence (PMS) stars that display properties such as an infra-red excess due to a circumstellar disc (van den Ancker et al. 2000; Meeus et al. 2001), and complex spectral line profiles (Herbig 1960; Finkenzeller & Mundt 1984; Hamann & Persson 1992b); akin to their solar-mass counterparts, the classical T Tauri stars, CTTs (see Bertout 1989, for a review). The HAeBes serve as excellent observational targets which can further our understanding of star formation, as they are readily observable at optical wavelengths unlike the Massive Young

⋆ Based on observations using the ESO Very Large Telescope, at Cerro Paranal , under the observing program 084.C-0952A † E-mail; john.fairlamb@gmail.com

Stellar Objects, MYSOs, which are still heavily embedded in their natal clouds (Mottram et al. 2011).

Theoretical models have long suggested that CTTs accrete via magnetospheric accretion, MA (Ghosh & Lamb 1979; Uchida & Shibata 1985; Koenigl 1991; Shu et al. 1994; Calvet & Gullbring 1998). In this scenario the circumstellar disc is truncated at a given radius from the star by the stellar magnetic field. The magnetic field lines can then funnel disc material onto the star, at approximately free-fall velocities, via an accretion column. This in-falling material shocks the photosphere and gives rise to hotspots on the stellar surface. The result is an excess of ultra-violet (UV) energy which is detectable in addition to the regular photospheric emission. This phenomenon has been observed in numerous CTTs to date (Calvet & Gullbring 1998; Gullbring et al. 1998, 2000; Ingleby et al. 2013), and has been shown to be present in HAeBes (Garrison 1978; Muzerolle et al. 2004; Donehew & Brittain 2011; Mendigutía et al. 2011, 2013; Fairlamb et al. 2015). Provided the stellar parameters are known, the accretion luminosity can be straight-forwardly

© 2016 RAS

2 J. R. Fairlamb et al.

converted into a mass accretion rate, Ṁacc, one of the key astrophysical parameters in star formation.

It has also been shown that the accretion luminosity ( Lacc) in CTTs, derived from an UV-excess or line veiling, is correlated with the luminosity of emission lines ( L_{line}). This appears to hold true for a large number of lines, such as Brγ, Hα, [O i]_{λ6300} , and the Ca ii IR-triplet (Muzerolle, Hartmann & Calvet 1998; Calvet et al. 2004; Dahm 2008; Herczeg & Hillenbrand 2008; Rigliaco et al. 2012; Alcalá et al. 2014). To date, the luminosity relationships for CTTs have largely been shown to hold for HAeBes too, with only minor changes in intercept and gradient (Mendigutía et al. 2011, 2013). This means that emission lines can be used as powerful accretion diagnostics and provide a method of inferring Ṁacc for stars where direct methods of measurement are difficult or impossible e.g. the UV-excess is often used to measure Ṁacc directly, but UVobservations are more difficult to obtain and interpret than simple emission lines; emission lines are also available at a variety of different wavelengths making them a preferred choice over UV observations in highly extinct targets. Therefore, by establishing correlations between the accretion luminosity and line luminosity for a large series of lines, possibilities to infer accretion rates when using data sets with a limited wavelength range are opened.

Changes in the accretion mechanism are suspected to be taking place towards the early-Be stars, as evidenced by spectropolarimetric observations (Vink et al. 2002, 2005). It was also thought that the Lacc and L_{line} relationship was breaking down towards HBes by Donehew & Brittain (2011). However, the observed change in the relationship can be explained by the adopted MA model which was for a single cool HAe star. In fact, the observed trends between Lacc and L_{line} have been explained by Mendigutía et al. (2015) to be a consequence of the luminosity of the star. Therefore, many observed relationships may not actually be directly due to accretion. However, any observed relationships can still be used to infer an accretion rate, meaning that they remain a valuable tool in this field. Therefore, a large scale investigation into these relationships for HAeBes is required.

In our previous paper in this series (Fairlamb et al. 2015, hereafter Paper I), we used spectroscopic data from X-Shooter, covering the UV, optical and near-infrared wavelengths, to determine the stellar parameters of a large sample of 91 HAeBe stars. Out of this sample, it was possible to determine the UV-excess, and thereby the accretion luminosity and mass accretion rates, for 62 of them. The large wavelength range of the data allows for the detection and measurement of many emission lines; observed simultaneously with the UV-excess. The large sample is therefore ideal to revisit the hitherto published line luminosities and accretion luminosity relationships, along with an investigation into new accretion diagnostics.

The overall aim of this paper is to provide the measurement of numerous spectral lines across the entire sample of 91 HAeBes. The strengths of the lines are investigated, along with a determinations of line luminosities based on previous stellar properties and photometry. These are compared against the accretion rates determined in Paper I in order to provide a critical assessment of accretion luminosity versus line luminosity relationships in HAeBes.

This paper is organised as follows. Section 2 provides details on the sample, data reduction, and techniques of emission line measurements and line luminosity calculations. Section 3 presents the measurements of the lines, calculated line luminosities, and the resulting correlations with the accretion luminosity. Analysis of these relationships and the presentation of new accretion diagnostics are provided in this section too. Finally, Section 4 provides a summary of the results and the concluding remarks.

2 SAMPLE, OBSERVATIONS, DATA

REDUCTION, AND MEASUREMENTS

The sample, observations and basic data reduction processes are detailed in paper I. We give a brief summary of these here, while we discuss the correction for telluric absorption lines and go into detail on the measurement of line strengths. The stars were selected from the catalogues of HAeBe stars published by Thé, de Winter & Perez (1994) and Vieira et al. (2003). The main criterion to be included the sample was their observability in the southern hemisphere during the (southern) summer semester. In total the sample contains 91 stars, of which 37 have a mass greater than 3 M⊙, which we choose to classify as the Herbig Be stars. The remaining stars are all HAes, with perhaps a few intermediate mass CTTs which border the mass boundary.

The observations were carried out with X-Shooter mounted on the ESO’s VLT, UT3, Paranal, Chile in the 2009-2010 season (Vernet et al. 2011). The instrument provides complete coverage from 0.3-2.4 μm over three separate arms; the arms are split into the following: the UVB arm, 3000–5600 Å; the VIS arm, 5500–10200 Å; and the NIR arm, 10200-24800 Å. The observations were taken with the smallest possible slit widths resulting in a spectral resolution of 10,000 - 18,000.

The integration times were such that signal-to-noise ratios of 100-200 were typical. The bias subtraction, flat fielding and wavelength calibration were all performed using the ESO pipeline reduction (Modigliani et al. 2010). When available, data were taken from the recent phase III release with pipeline version 2.3.12. For the small number where this was not the case, the reduced data from paper I (pipeline version 0.9.7) are taken. In general, the quality of the reduced data in both cases is similar, except in the NIR arm where the SNR is better in the phase III data.

The spectra were not flux calibrated as a matter of course, and instead we use published photometry of all our sources when computing the final line luminosities (see Paper I for details of photometry sources). Since the typical errors in the flux determination from spectrophometric data amount to around 20%, this choice is warranted for objects that vary less than 20% (or roughly 0.2 magnitude). It has been shown in PMS-stars that the variability amplitude decreases with increasing wavelength e.g. for a change in the V-band of 0.4 mag changes in the K-band are generally less than 0.2 mag (Eiroa et al. 2001, 2002). Spot-checks on our targets indicate that the variability is indeed at most of this order on average, validating the choice of using existing photometry. Due to the large sample used any objects with large variability changes, that could produce anomalous results, are likely to be identified or their effects diluted by the sheer number of other targets used.

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II 3

2.1 Correction for telluric absorption lines

Before measurements of the lines are undertaken, telluric absorption features in the spectra must be removed. This is particularly necessary for the majority of the observable emission lines in the near-infrared (NIR) arm, but also for a few cases in the VIS arm covering the optical.

A telluric standard star can be used for such a correction, but these stars contain their own spectral features, which also need to be corrected for. Since many of the lines observed are hydrogen recombination lines, which are commonly seen in absorption in telluric standard stars, correction is instead performed using the ESO Molecfit^1 telluric removal tool (Smette et al. 2015; Kausch et al. 2015). There are a few additional issues that contributed to rejecting the telluric standard and using Molecfit instead: airmass could differ by large amounts (mostly uncommon), and short exposure times of the tellurics (on average the SNR was half that of the targets). Molecfit provides an atmospheric transmission spectrum using a radiative transfer code based upon a combination of the observatory conditions at the time and the features observed in the target spectra. Removal of the lines using both Molecfit and telluric standards were compared and it was found that using Molecfit yielded better quality spectra over using the telluric standards; the SNR of the latter contributes to a poorer reduction.

Therefore, Molecfit correction is performed on all spectral orders in each arm that contains telluric line features, and will be used for the remainder of this paper (see also Ilee et al. 2014, where Molecfit is used in the same way to study the CO overtone emission at 2.3μm).

2.2 Measuring emission line strengths

After telluric corrections, line strengths are recorded by measuring the equivalent widths, EW, of the lines after normalising the spectra of each star to the continuum level. These direct measurements of the EW will be referred to as EW_{obs}. In order to obtain the true line strengths of the emission lines EW_{obs} needs to be corrected for both the underlying photospheric absorption, EWint, and the presence of any excess continuum emission, which would dilute the underlying absorption.

The photospheric absorption depends upon the temperature, surface gravity, and metallicity of the stars. The temperature and surface gravity of each star were determined in Paper I and are used to select an appropriate spectral model atmosphere, from which the absorption line strengths are measured. In this work the Munari set of Kurucz-Castelli models, KC-models, are used for lines with λ < 10050 Å, due to their 1 Å sampling (Munari et al. 2005); a metalicity of [M/H]=0 is adopted. For longer wavelengths additional models are required, the older KC-models are used here computed by Kurucz (1993); Castelli & Kurucz (2004). For consistency, the same region of measurement used for EW_{obs} is used for measuring EWint. Figure 1 provides an example of the intrinsic absorption strength as a function of temperature for some of the lines (log(g) is fixed in this example).

1 http://www.eso.org/sci/software/pipelines/skytools/molecfit

Figure 1. The two panels above shown how EW_{int} varies as a function of temperature. More importantly it demonstrates that the variation is significantly different between different elements e.g. Hydrogen absorption peaks at ∼ 9000 K, while Helium absorption peaks at ∼ 20000 K.

The net emission, which is stronger than the straightforward measurement of EW_{obs} would imply, can now be corrected for the intrinsic absorption. The corrected equivalent width, EWcor, is calculated as follows:

EWcor = EW_{obs} − 10^{−0.4Δmλ} EWint (1)

where Δm_λ is the strength of the continuum excess at the wavelength in question, measured in magnitudes. It is the difference between the observed, dereddened magnitude and the intrinsic magnitude of a star of the same spectral type.

Figure 2 demonstrates the importance of correcting for intrinsic absorption. In the figure it can be seen that UX Ori definitely has emission present. However, when measuring EW_{obs} a positive value is obtained i.e. an absorption line. Correcting for EWint makes EWcor negative, and therefore in emission. The benefit of this approach is that the result encompasses all of the true emission.

At near-infrared wavelengths excess emission is also present, due to thermal emission from circumstellar dust heated by the central star. i.e. there is a non-zero Δm_λ component, for the majority of stars, because of the IR-excess. In order to obtain Δm_λ the intrinsic magnitude is first obtained by scaling a KC-model of the same stellar parameters to match the dereddened visible photometry of the star and measuring the flux from the model at the wavelength in question (the compiled photometry is listed in paper I). To avoid underestimating the continuum flux, which can be affected by the underlying absorption in the model, an interpolation of the continuum regions either side of the line is used to derive the continuum flux. This is then converted

4 J. R. Fairlamb et al.

Figure 2. The Hα line for UX Ori is displayed here; the original spectra is shown in black. Also plotted here are: the predicted intrinsic spectra, red-dashed; the corrected spectra, blue-dotted; the continuum level, grey-dashed; and finally the left and right continuum regions which are used for normalising the lines, solidgrey. The left-hand legend details the properties of UX Ori. The figure demonstrates that despite clear emission a positive EW_{obs} can be measured. Therefore it is also important to assess EW_{int} when examining the strength of lines.

into a magnitude to give the expected intrinsic magnitude (since this is at an arbitrary wavelength no convolutions with pass-bands are involved). Next, this must be compared against the observed dereddened magnitude. This makes use of the JHK photometric data from 2MASS (Cutri et al. 2003; Skrutskie et al. 2006). The photometry is dereddened and converted into a flux using the AV values determined in Paper I, and then an interpolation is made between the photometric points either side of the wavelength in question (and converted back into a magnitude). With both the observed and expected intrinsic magnitudes obtained, Δm_λ is found via the difference; EWcor can now be calculated.

2.3 Error budget

A consideration of errors needs to be made in all the above steps. Let us first start with the line measurement itself. Since EW_{obs} is a numerical calculation over a wavelength region, the error will be the extent of this region, Δλ divided by the SNR of the continuum: σ_{EWobs} = Δλ/SNR. The error on EWint is also complicated by stellar parameters, metallicity, and the adopted set of models. For this reason a generous error of 10% is adopted for all EWint measured from the Munari set of KC-Models; an error of 20% is adopted for the NIR lines measured from the lower resolution models. Errors in Δm_λ are low, due to the quality of the JHK photometry, and the relatively low errors in the stellar parameters. Since the EW errors dominate over Δm_λ only the EW_{obs} and EWint errors are considered in EWcor. With EWcor established, a line flux, F_{line}, can now be calculated by F_{line} = EWcor×F_λ, where F_λ is the continuum flux corresponding to the central wavelength of the line. For all lines with line centres < 1 μm, F_λ is calculated from a KC-model in the same way the intrinsic magnitude was calculated earlier (but omitting the final magnitude conversion). For the lines with line centres > 1 μm, an interpolation of the dereddened JHK photometry is performed in the same manner as was done for obtaining the IR-excess magnitude earlier, except a further step is required of converting this into a flux.

Expanding upon this, a line luminosity, L_{line} ,is also calculated by: L_{line} = 4πD^2 F_{line}, where D is the distance to star (the values used are complied in Paper I). The L_{line} value takes into account both errors on the distance and the stellar parameters used to calculate F_{line}. A complete list of errors on L_{line} are included in the online version of table 1.

3 RESULTS

In total, EW_{obs}, EWint, EWcor and the corresponding line luminosities are calculated for a set of 32 different lines. The lines were selected based on being observed previously in the literature, or by having a high detection rate throughout the sample; preferably both. These lines span the full wavelength range covered. To put the number of lines into perspective, we note that lines previously identified in the literature as accretion diagnostics for HAeBes stars are limited to Hα, [Oi]6300 and Brγ (Donehew & Brittain 2011; Mendigutía et al. 2011); hence the number of lines investigated in this manner has increased tenfold.

The EW, F_{line}, and L_{line} data for the Hα line are provided in Table 1. The table contains this information for all of the observed targets. A further 31 lines have been measured and are available online.

The following sections investigate the empirical relationship between the line luminosities and the accretion luminosities, along with a comparison against CTTs.

3.1 Accretion luminosity - line luminosity relationships

In Figure 3 the relationship between the accretion luminosity Lacc, derived for 62 stars using the UV-excess, is shown plotted against the luminosity of six different emission lines. The selected lines are He i_{λ5876}, Hα, O i_{λ7773}, He i_{λ10830} , Paβ, and Brγ as they cover a large wavelength range and a few different elemental species. Correlations for other lines are available in the on-line version of this paper.

The line luminosity–accretion luminosity relationship can be approximated by a power law, and has been in numerous works on CTTs and HAeBes (Muzerolle, Hartmann & Calvet 1998; Calvet et al. 2004; Dahm 2008; Herczeg & Hillenbrand 2008; Mendigutía et al. 2011; Rigliaco et al. 2012), where :

log ( Lacc L⊙ ) = A + B × log ( L_{line} L⊙ ) (2) where A and B are constants describing the intercept and slope respectively. Such a relationship is obtained across all lines for the Herbig Ae/Be stars; the slopes and intercepts

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II 5

Table 1. This table provides the EW measurements for the Hα line in all objects. A full version of this table containing all 32 lines is available online. It is worth noting that the Δm_λ column contains no values for this particular line as no correction for an excess is required; an IR-excess correction is required for lines >1 μm. In column 6, containing the line flux, the ‘E−x’ factor denotes ×10^x.

Details of the Hα line

Name EW_{obs} EW_{int} Δm_λ EW_{cor} F_{line} log( L_{line}) ( Å) ( Å) (mag) ( Å) (Wm^{−2} Å^{−1}) [ L_⊙]

UX Ori 2.39 ± 0.34 14.65 ± 1.47 - -12.26 ± 1.51 3.27 (± 0.40) E -15 -1.43 ± 0.10 PDS 174 -54.19 ± 1.34 6.46 ± 0.65 - -60.65 ± 1.49 2.33 (± 0.06) E -14 -0.03 ± 0.09 V1012 Ori 4.74 ± 0.55 16.36 ± 1.64 - -11.62 ± 1.73 1.42 (± 0.21) E -15 -2.06 ± 0.11 HD 34282 4.18 ± 0.40 16.23 ± 1.62 - -12.05 ± 1.67 3.03 (± 0.42) E -15 -1.90 ± 0.11 HD 287823 10.18 ± 0.50 15.58 ± 1.56 - -5.40 ± 1.64 1.64 (± 0.50) E -15 -2.23 ± 0.16 HD 287841 8.36 ± 0.43 13.22 ± 1.32 - -4.86 ± 1.39 9.64 (± 2.75) E -16 -2.46 ± 0.15 HD 290409 0.35 ± 0.55 15.00 ± 1.50 - -14.65 ± 1.60 3.18 (± 0.35) E -15 -1.58 ± 0.10 HD 35929 1.54 ± 0.69 8.69 ± 0.87 - -7.15 ± 1.11 1.09 (± 0.17) E -14 -1.35 ± 0.11 HD 290500 -1.46 ± 0.25 13.14 ± 1.31 - -14.60 ± 1.33 1.26 (± 0.11) E -15 -1.04 ± 0.10 HD 244314 -14.04 ± 0.61 15.54 ± 1.55 - -29.58 ± 1.67 6.91 (± 0.39) E -15 -1.38 ± 0.09 HK Ori -61.86 ± 0.72 15.79 ± 1.58 - -77.65 ± 1.74 1.51 (± 0.03) E -14 -1.04 ± 0.09 HD 244604 2.32 ± 0.51 14.79 ± 1.48 - -12.47 ± 1.57 5.72 (± 0.72) E -15 -1.46 ± 0.10 UY Ori 4.98 ± 0.26 15.28 ± 1.53 - -10.30 ± 1.55 4.81 (± 0.72) E -16 -1.80 ± 0.11 HD 245185 -13.56 ± 0.50 14.48 ± 1.45 - -28.04 ± 1.53 6.54 (± 0.36) E -15 -1.26 ± 0.09 T Ori -4.15 ± 0.43 13.07 ± 1.31 - -17.22 ± 1.38 1.04 (± 0.08) E -14 -0.74 ± 0.09 V380 Ori -81.88 ± 0.48 13.61 ± 1.36 - -95.49 ± 1.44 9.74 (± 0.15) E -14 -0.48 ± 0.09 HD 37258 -0.33 ± 0.39 15.00 ± 1.50 - -15.33 ± 1.55 4.88 (± 0.49) E -15 -1.56 ± 0.10 HD 290770 -24.08 ± 0.35 12.98 ± 1.30 - -37.06 ± 1.35 1.57 (± 0.06) E -14 -1.02 ± 0.09 BF Ori -0.02 ± 0.46 14.70 ± 1.47 - -14.72 ± 1.54 5.35 (± 0.56) E -15 -1.36 ± 0.10 HD 37357 4.76 ± 0.41 14.64 ± 1.46 - -9.88 ± 1.52 6.32 (± 0.97) E -15 -1.63 ± 0.11 HD 290764 -2.38 ± 0.43 13.31 ± 1.33 - -15.69 ± 1.40 5.03 (± 0.45) E -15 -1.46 ± 0.10 HD 37411 -1.07 ± 0.47 15.55 ± 1.56 - -16.62 ± 1.63 5.29 (± 0.52) E -15 -1.67 ± 0.10 V599 Ori 1.69 ± 0.57 13.35 ± 1.34 - -11.66 ± 1.46 6.48 (± 0.81) E -15 -1.28 ± 0.10 V350 Ori 3.09 ± 0.33 15.66 ± 1.57 - -12.57 ± 1.60 2.52 (± 0.32) E -15 -1.69 ± 0.10 HD 250550 -48.83 ± 0.39 10.03 ± 1.00 - -58.86 ± 1.07 2.01 (± 0.04) E -14 -0.22 ± 0.09 V791 Mon -88.08 ± 0.25 7.94 ± 0.79 - -96.02 ± 0.83 4.22 (± 0.04) E -14 -0.26 ± 0.09 PDS 124 -13.83 ± 1.37 14.13 ± 1.41 - -27.96 ± 1.97 2.02 (± 0.14) E -15 -1.30 ± 0.09 LkHa 339 -5.39 ± 1.37 12.98 ± 1.30 - -18.37 ± 1.89 4.24 (± 0.44) E -15 -1.33 ± 0.10 VY Mon -17.81 ± 1.76 8.45 ± 0.84 - -26.26 ± 1.95 6.94 (± 0.52) E -14 -0.38 ± 0.09 R Mon -114.51 ± 1.76 9.35 ± 0.93 - -123.86 ± 1.99 4.22 (± 0.07) E -14 -0.07 ± 0.09 V590 Mon -60.10 ± 0.52 9.63 ± 0.96 - -69.73 ± 1.09 3.46 (± 0.05) E -15 -0.49 ± 0.09 PDS 24 -25.47 ± 1.79 12.98 ± 1.30 - -38.45 ± 2.21 1.17 (± 0.07) E -15 -1.00 ± 0.09 PDS 130 -31.17 ± 0.70 11.41 ± 1.14 - -42.58 ± 1.34 2.75 (± 0.09) E -15 -0.58 ± 0.09 PDS 229N 7.41 ± 0.82 9.63 ± 0.96 - -2.22 ± 1.26 1.72 (± 0.97) E -16 -1.99 ± 0.26 GU CMa -14.86 ± 0.48 4.75 ± 0.47 - -19.61 ± 0.67 1.61 (± 0.06) E -13 0.15 ± 0.09 HT CMa -20.94 ± 0.35 11.87 ± 1.19 - -32.81 ± 1.24 1.75 (± 0.07) E -15 -0.84 ± 0.09 Z CMa -63.55 ± 0.99 9.97 ± 1.00 - -73.52 ± 1.41 7.72 (± 0.15) E -13 1.43 ± 0.09 HU CMa -52.00 ± 0.40 9.09 ± 0.91 - -61.09 ± 0.99 6.64 (± 0.11) E -15 -0.50 ± 0.09 HD 53367 -7.62 ± 0.52 4.02 ± 0.40 - -11.64 ± 0.66 2.15 (± 0.12) E -13 -0.11 ± 0.09 PDS 241 -8.36 ± 0.29 4.21 ± 0.42 - -12.57 ± 0.51 4.32 (± 0.17) E -15 0.06 ± 0.09 NX Pup -37.01 ± 0.45 8.74 ± 0.87 - -45.75 ± 0.98 1.75 (± 0.04) E -14 -1.04 ± 0.09 PDS 27 -73.20 ± 0.73 4.40 ± 0.44 - -77.60 ± 0.85 1.08 (± 0.01) E -13 1.53 ± 0.09 PDS 133 -103.11 ± 3.91 7.84 ± 0.78 - -110.95 ± 3.99 4.99 (± 0.18) E -15 -0.01 ± 0.09 HD 59319 5.86 ± 6.14 7.13 ± 0.71 - -1.27 ± 6.18 < 1.19 E -15 < -1.26 PDS 134 -12.22 ± 0.41 5.98 ± 0.60 - -18.20 ± 0.73 1.58 (± 0.06) E -15 0.20 ± 0.09 HD 68695 0.48 ± 0.48 16.51 ± 1.65 - -16.03 ± 1.72 4.18 (± 0.45) E -15 -1.81 ± 0.10 HD 72106 8.78 ± 0.63 14.60 ± 1.46 - -5.82 ± 1.59 4.77 (± 1.30) E -15 -1.69 ± 0.15 TYC 8581-2002-1 11.05 ± 0.42 13.61 ± 1.36 - -2.56 ± 1.42 3.50 (± 1.95) E -16 -2.05 ± 0.26 PDS 33 -3.10 ± 0.48 15.83 ± 1.58 - -18.93 ± 1.65 7.90 (± 0.69) E -16 -1.67 ± 0.09 HD 76534 -11.00 ± 0.34 5.84 ± 0.58 - -16.84 ± 0.67 3.63 (± 0.15) E -14 -0.44 ± 0.09 PDS 281 4.30 ± 0.49 5.42 ± 0.54 - -1.12 ± 0.73 3.81 (± 2.48) E -15 -0.98 ± 0.30 PDS 286 -26.84 ± 0.42 3.93 ± 0.39 - -30.77 ± 0.57 2.75 (± 0.05) E -13 0.37 ± 0.09 PDS 297 7.42 ± 0.41 11.36 ± 1.14 - -3.94 ± 1.21 2.80 (± 0.86) E -16 -1.73 ± 0.16 HD 85567 -50.25 ± 0.47 6.76 ± 0.68 - -57.01 ± 0.83 1.09 (± 0.02) E -13 0.45 ± 0.09 HD 87403 6.79 ± 0.63 9.76 ± 0.98 - -2.97 ± 1.17 1.27 (± 0.50) E -15 -0.89 ± 0.19 PDS 37 -119.89 ± 0.47 3.87 ± 0.39 - -123.76 ± 0.61 2.53 (± 0.01) E -13 2.17 ± 0.09 HS 305298 0.01 ± 0.41 3.25 ± 0.32 - -3.24 ± 0.52 9.93 (± 1.59) E -16 -0.45 ± 0.11 HD 94509 -16.84 ± 0.53 6.33 ± 0.63 - -23.17 ± 0.82 1.09 (± 0.04) E -14 0.82 ± 0.09

6 J. R. Fairlamb et al.

Table 1 – continued

Details of the XXXXXX line

Name EW_{obs} EW_{int} Δm_λ EW_{cor} F_{line} log( L_{line}) ( Å) ( Å) (mag) ( Å) (Wm^{−2} Å^{−1}) [ L_⊙]

HD 95881 -12.53 ± 0.39 9.35 ± 0.94 - -21.88 ± 1.02 2.60 (± 0.12) E -14 0.13 ± 0.09 HD 96042 3.20 ± 0.80 3.95 ± 0.39 - -0.75 ± 0.89 < 1.27 E -15 < -0.90 HD 97048 -24.43 ± 0.34 13.54 ± 1.35 - -37.97 ± 1.39 8.06 (± 0.30) E -14 -1.13 ± 0.09 HD 98922 -14.64 ± 0.44 10.04 ± 1.00 - -24.68 ± 1.09 1.16 (± 0.05) E -13 -0.36 ± 0.09 HD 100453 5.27 ± 0.77 10.23 ± 1.02 - -4.96 ± 1.28 9.50 (± 2.45) E -15 -2.35 ± 0.14 HD 100546 -23.96 ± 0.42 15.50 ± 1.55 - -39.46 ± 1.61 1.76 (± 0.07) E -13 -1.29 ± 0.09 HD 101412 -0.15 ± 0.69 15.28 ± 1.53 - -15.43 ± 1.68 8.38 (± 0.91) E -15 -1.62 ± 0.10 PDS 344 -22.23 ± 0.45 7.80 ± 0.78 - -30.03 ± 0.90 7.69 (± 0.23) E -16 -0.74 ± 0.09 HD 104237 -13.74 ± 0.98 13.75 ± 1.38 - -27.49 ± 1.69 1.61 (± 0.10) E -13 -1.18 ± 0.09 V1028 Cen -101.61 ± 0.52 7.01 ± 0.70 - -108.62 ± 0.87 2.22 (± 0.02) E -14 0.37 ± 0.09 PDS 361S -3.97 ± 0.45 5.35 ± 0.53 - -9.32 ± 0.70 8.10 (± 0.60) E -16 -0.31 ± 0.09 HD 114981 -7.60 ± 0.46 5.64 ± 0.56 - -13.24 ± 0.72 3.37 (± 0.18) E -14 -0.06 ± 0.09 PDS 364 -78.38 ± 0.74 9.63 ± 0.96 - -88.01 ± 1.21 4.40 (± 0.06) E -15 -0.39 ± 0.09 PDS 69 -69.42 ± 1.30 7.00 ± 0.70 - -76.42 ± 1.48 8.40 (± 0.16) E -14 0.02 ± 0.09 DG Cir -47.98 ± 0.83 13.10 ± 1.31 - -61.08 ± 1.55 6.27 (± 0.16) E -15 -1.00 ± 0.09 HD 132947 10.38 ± 0.33 11.96 ± 1.20 - -1.58 ± 1.24 9.04 (± 7.12) E -16 -2.04 ± 0.35 HD 135344B -4.60 ± 0.75 5.66 ± 0.57 - -10.26 ± 0.94 1.35 (± 0.12) E -14 -2.08 ± 0.10 HD 139614 0.48 ± 0.61 13.26 ± 1.33 - -12.78 ± 1.46 1.33 (± 0.15) E -14 -2.09 ± 0.10 PDS 144S -16.12 ± 0.68 13.07 ± 1.31 - -29.19 ± 1.48 9.49 (± 0.48) E -16 -1.53 ± 0.09 HD 141569 5.13 ± 0.57 15.55 ± 1.56 - -10.42 ± 1.66 3.36 (± 0.54) E -14 -1.88 ± 0.11 HD 141926 -43.48 ± 0.43 3.40 ± 0.34 - -46.88 ± 0.55 3.00 (± 0.04) E -13 1.17 ± 0.09 HD 142666 5.14 ± 0.68 11.70 ± 1.17 - -6.56 ± 1.35 9.17 (± 1.89) E -15 -2.22 ± 0.12 HD 142527 -6.95 ± 0.98 6.18 ± 0.62 - -13.13 ± 1.16 1.91 (± 0.17) E -14 -1.93 ± 0.10 HD 144432 -0.98 ± 0.68 11.65 ± 1.17 - -12.63 ± 1.35 1.76 (± 0.19) E -14 -1.85 ± 0.10 HD 144668 -8.41 ± 0.45 14.12 ± 1.41 - -22.53 ± 1.48 1.40 (± 0.09) E -13 -0.95 ± 0.09 HD 145718 8.34 ± 0.52 14.53 ± 1.45 - -6.19 ± 1.54 6.86 (± 1.71) E -15 -2.34 ± 0.14 PDS 415N 3.10 ± 1.30 5.04 ± 0.50 - -1.94 ± 1.39 2.45 (± 1.76) E -16 -3.53 ± 0.32 HD 150193 -5.59 ± 0.57 16.07 ± 1.61 - -21.66 ± 1.71 6.21 (± 0.49) E -14 -1.55 ± 0.09 AK Sco -0.82 ± 0.95 5.06 ± 0.51 - -5.88 ± 1.08 4.81 (± 0.88) E -15 -2.60 ± 0.12 PDS 431 1.27 ± 0.50 10.49 ± 1.05 - -9.22 ± 1.16 4.41 (± 0.56) E -16 -0.94 ± 0.10 KK Oph -25.15 ± 0.31 16.36 ± 1.64 - -41.51 ± 1.67 1.28 (± 0.05) E -14 -1.50 ± 0.09 HD 163296 -3.63 ± 0.36 16.02 ± 1.60 - -19.65 ± 1.64 7.82 (± 0.65) E -14 -1.60 ± 0.09 MWC 297 -590.00 ± 0.90 4.52 ± 0.45 - -594.52 ± 1.01 4.68 (± 0.01) E -11 1.63 ± 0.09

are presented in Table 2. The best-fits were calculated using the IDL mpfitexy package, which factors in errors in both the x and y axis. Figure A1, in the Appendix, displays the correlations for all lines observed; Table 2 provides details of the correlations. Where possible the findings of Alcalá et al. (2014) on a set of CTTs are shown in these figures for comparison. The same relationship between the line and accretion luminosities observed for CTTs, and reported previously in HAeBes, extends to other lines as well. Indeed, this trend is essentially observed for all lines. The strong correlation between line luminosity and accretion luminosity is the reason why emission lines are a useful tool for easily determining accretion luminosities (and in turn determining the mass accretion rate).

A comparison with previous determinations of the slope and intercept derived in the literature for Herbig Ae/Be stars is made here. Specifically the Hα, [O i]_{λ6300}, and Brγ relationships from Mendigutía et al. (2011) are assessed. It is found that the relationships obtained here agree with previous work; they lie within the errorbars of each other. The main difference here is that the errors, particularly on the intercept, are reduced here. This is presumably due to the increased sample size and simultaneity of the observations of the UV excess and lines.

The relationship for Brγ in this paper agrees well with Mendigutía et al. (2011). Both of these relationships do not agree with the breakdown in Brγ relationship implied by Donehew & Brittain (2011). This can be attributed to the MA models used in the latter being associated with a relatively low mass HAeBe star, producing lower accretion luminosities than expected; their model was based upon UX Ori from Muzerolle et al. (2004), while this work focuses on multiple models from Mendigutía et al. (2011) and Paper I. Therefore, we can say that there remains a Lacc- L_{line} relationship for HAeBes.

3.2 Comparison with T Tauri stars

The data on CTTs from Alcalá et al. (2014) for the lines in common with this study are also included for comparison, along with their best fit in Figure A1. Overall, the plots appear to show a qualitative agreement in trends between the HAeBes and the CTTs, where Lacc is increasing proportionally to L_{line} , generally a 1:1 correlation. The placement of the CTTs and HAeBes in the plots often agree with each where they transition between each other, suggesting similarity between the two groups. An exception is the Ca II

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II 7

Figure 3. Relationships are displayed between the accretion luminosities determined in Paper I and the line luminosities determined in this work. Each panel shows only the HAeBes where both a clear UV-excess and clear emission line detection are made, shown as grey squares;a best-fit to them is shown as a solid-black line (the equation for the line is given below the line descriptor in the top-left of each panel). The relationships are all comparable to each other with the average exponent of each relationship being ∼ 1.19 ± 0.18.

8 J. R. Fairlamb et al.

triplet where there is an offset, likely due to blending with the Paschen series. The best-fit relationship to the HAeBes is generally steeper than it is for the extrapolated CTTs best-fit, suggesting a possible difference in the origin of the line luminosity. However, this is not true in all cases and the average of all relationships are in agreement with each other. The slope of the Lacc vs. L_{line} relationship, the B value, is found to have an average of B̄ = 1.16 ± 0.15 in the HAeBes, while for the CTTs it is B̄ = 1.08±0.08. The values of the best-fit relationships for the CTTs and the HAeBes are provided in Table 2.

Overall, it appears that the relationship between Lacc and L_{line} , for all lines, is well correlated in HAeBes. This confirms the predictions of Mendigutía et al. (2015) that the relationship is a mathematical one tied to the luminosity stars rather than the actual strengths of the lines The slope of the relationships obtained here are slightly enhanced over the set of CTTs analysed by Alcalá et al. (2014). A small level of caution should be noted if using the relationships of the Ca ii triplet due to Paschen blending which may be causing the offset observed between HAeBes and CTTs. Another note of caution is advised when using the He I and O I lines, as their complex line profiles suggest various origins – which may or may not be associated with accretion. The complexities of their profiles are likely the cause of the low detection rate of these lines, as multiple absorption and emission components can contribute to the line equivalent width. An exploration of the line profiles will be presented in a future paper by the authors.

3.3 Emission lines as accretion diagnostics:

Since all of the emission lines appear to be correlated with the accretion luminosity it is worth discussing which lines serve as the most sensitive tracers of accretion i.e. most readily detected (and therefore possibly associated directly with accretion). That way the best lines can be prioritised in future observations.

In Table 3 all 32 lines are presented along with details of the number of emission detections. The other columns of the table are split into different categories based upon emission detection and UV-excess detection. The total accretion rate detection is defined as all of the HAeBes for which an UVexcess was clearly detected in Paper I – 62 stars match this criteria. This includes the 7 stars in which an accretion rate could not be determined within the context of MA; it would require an unrealistically high filling factor of shocked material to reproduce their UV excess. The measured ΔDB of these 7 objects is likely associated with accretion due to the overall properties of the stars, although the exact mechanism is not known (an alternative could be Boundary Layer accretion for these hot objects Bertout, Basri & Bouvier (see 1988); Blondel & Djie (see 2006))^2.

The two categories of emission and accretion can be divided into two outcomes for each case, those with and those without. This gives a total of four possible categories for a star to be in e.g. a star may have a particular line in emission, but no ΔDB was detected in the star.

2 Since Ṁ_{acc} was not determined for these stars they do not contribute to the fits in Figure 3.

Table 3 gives the number of stars split into each category, for each line, and is presented visually in Figure 4. What the four different categories represent are now detailed:

(i) The first category contains objects for which both emission lines and a UV excess are detected, represented by the green segments in the diagram. This category measures if the line is a good one to one tracer of accretion i.e. excess is present and so is the emission line. Examples of good tracers are Hα, Brγ, and Paβ as their emission detections fall predominately in this category.

(ii) The second category indicates how difficult the line is to detect i.e. how insensitive it is. This category is shown in red and contains those stars for which a clear UV excess is detected and for which a mass accretion rate could be derived, but in whose spectra no emission line is detected. An example of this is the oxygen 7773 Å line, for which the majority of ΔDB detections have no corresponding emission line detection.

(iii) The third category (shown in yellow in the figure) denotes the objects for which an emission line is detected, but no UV excess was detected. Assuming that the emission line is sensitive to accretion, and more readily detectable than an excess, the lines in this category allow the Lacc vs. L_{line} relationship to be used to infer an accretion luminosity.

(iv) The fourth and final category, shown in orange, contains those objects with no obvious UV excess and no emission in the line of interest. These objects generally have Hα emission, but no sign of other emission lines. If they are actively accreting, the mass accretion rate is well below our detection limits (the lowest log( Ṁacc) detected in Paper I was only -7.78).

The findings in the table and figure highlight that the already established accretion tracing relationships are good ones; Hα, Brγ, and Paβ are all predominately in the green. There are also lines which appear to be poor tracers of accretion. In particular the Brackett series appears to get worse as an accretion tracer towards the higher order transitions. Such a decline is likely because of the decreasing strength in emission towards the shorter wavelengths; which is supported by the green/red ratio changing between successive orders (with a slight deviation around Br 12-4). The Balmer series demonstrates a similarity to this with the two lowest level transitions, Hα and Hβ, being sensitive to accretion while the remainder are less sensitive. The explanation for this is likely to be the same as for the Brackett series, however, another possible explanation for this could be the UVexcess veiling the lines. Veiling of the lines occurs when their intrinsic absorption is filled in by excess emission, which decreases the observed absorption in them and gives then an EW_{obs} closer to 0. However, the brightest of HAeBes makes this scenario unlikely. The Paschen series is an exception to the other two hydrogen series; it maintains a constant level of sensitivity throughout the series. This is due to the location of the lines; the visible region. The SNR here is much higher than the UV and allows us to make a greater number of detections. While in the NIR, due to telluric line correction and IR-excess correction, there is greater margin of error for detection than the visible. As for the Ca II line it is likely that the Paschen blending results in more detections

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II 9

Table 2. This table details the number of emission lines detected for each line (Column 4) and the number of these used in determining L_{acc}- L_{line} relationships (Column 5). The nubmer of lines used is less as they must have a corresponding UV-excess to be included. The best-fitting slopes and intercepts to the luminosity relationships plotted in Figures 3 and A1 are provided in columns 6 and 7. The best-fit parameters for the CTTs presented by Alcalá et al. (2014) are provided in the final two columns for comparison.

Line λ Line No. No. This work Alcalá et al. (2014) No. (Å) Detections Used A ± σ_A B ±σ_B A ±σ_A B ± σ_B

1 3797 H(10-2) 42 30 3.04 ± 0.14 1.14 ± 0.08 2.58 ± 0.27 1.00 ± 0.05 2 3835 H(9-2) 24 16 2.91 ± 0.14 1.06 ± 0.10 2.53 ± 0.27 1.01 ± 0.05 3 3889 H(8-2) 22 18 2.96 ± 0.16 1.17 ± 0.11 2.55 ± 0.29 1.04 ± 0.06 4 4102 Hdelta 23 14 2.65 ± 0.13 1.14 ± 0.10 2.50 ± 0.28 1.06 ± 0.06 5 4340 Hgamma 37 25 2.51 ± 0.10 1.10 ± 0.09 2.50 ± 0.25 1.09 ± 0.05 6 4861 Hbeta 81 51 2.60 ± 0.09 1.24 ± 0.07 2.31 ± 0.23 1.11 ± 0.05 7 5876 He I 31 24 4.39 ± 0.38 1.21 ± 0.13 3.51 ± 0.30 1.13 ± 0.06 8 6300 [O I] 48 28 3.84 ± 0.16 0.94 ± 0.06 - ± - - ± - 9 6563 Halpha 89 54 2.09 ± 0.06 1.00 ± 0.05 1.50 ± 0.26 1.12 ± 0.07 10 7773 O I 29 21 3.80 ± 0.26 0.97 ± 0.10 3.91 ± 0.51 1.16 ± 0.09 11 8446 O I 57 37 3.61 ± 0.14 0.90 ± 0.05 3.06 ± 0.90 1.06 ± 0.18 12 8498 Ca II 41 29 3.50 ± 0.14 0.91 ± 0.06 2.18 ± 0.38 0.95 ± 0.07 13 8542 Ca II 34 26 3.62 ± 0.15 1.04 ± 0.07 2.13 ± 0.42 0.95 ± 0.08 14 8598 Pa(14-3) 74 49 3.88 ± 0.14 1.13 ± 0.06 - ± - - ± - 15 8662 Ca II 79 52 3.45 ± 0.12 1.08 ± 0.05 2.20 ± 0.43 0.95 ± 0.09 16 8750 Pa(12-3) 89 55 3.87 ± 0.14 1.34 ± 0.06 - ± - - ± - 17 8863 Pa(11-3) 78 51 3.81 ± 0.15 1.29 ± 0.07 - ± - - ± - 18 9015 Pa(10-3) 87 54 3.81 ± 0.15 1.43 ± 0.07 2.99 ± 0.49 1.03 ± 0.09 19 9229 Pa(9-3) 73 46 3.72 ± 0.15 1.31 ± 0.07 3.40 ± 0.47 1.13 ± 0.09 20 9546 Paepsilon 86 54 3.75 ± 0.14 1.38 ± 0.07 3.19 ± 0.58 1.11 ± 0.12 21 10049 Padelta 65 43 4.01 ± 0.17 1.26 ± 0.07 3.33 ± 0.47 1.18 ± 0.10 22 10829 He I 40 27 4.92 ± 0.38 1.42 ± 0.13 2.62 ± 0.57 1.11 ± 0.12 23 10938 Pagamma 71 46 3.76 ± 0.16 1.26 ± 0.07 3.17 ± 0.31 1.18 ± 0.06 24 12818 Pabeta 78 50 3.47 ± 0.13 1.26 ± 0.07 2.45 ± 0.39 1.04 ± 0.08 25 15439 Br(17-4) 27 17 4.25 ± 0.27 0.94 ± 0.11 - ± - - ± - 26 15556 Br(16-4) 41 26 4.35 ± 0.21 1.05 ± 0.08 - ± - - ± - 27 15701 Br(15-4) 37 25 4.33 ± 0.21 1.06 ± 0.08 - ± - - ± - 28 15880 Br(14-4) 33 23 4.27 ± 0.23 1.09 ± 0.09 - ± - - ± - 29 16109 Br(13-4) 55 40 4.41 ± 0.20 1.21 ± 0.08 - ± - - ± - 30 16407 Br(12-4) 44 30 4.37 ± 0.22 1.22 ± 0.09 - ± - - ± - 31 16806 Br(11-4) 61 44 4.60 ± 0.21 1.32 ± 0.08 - ± - - ± - 32 21661 Brgamma 69 43 4.46 ± 0.23 1.30 ± 0.09 3.60 ± 0.38 1.16 ± 0.07

for the 8662 line than the other two, as it is blended with the stronger Paschen lines.

As for lines which lean more towards being poor tracers of accretion, like the O I 7773 Å and the He I 5876 Å lines. A possible explanation is that EWint is measured as a sum over the entire line profile. This means that complex profiles, with multiple absorption and emission components, may be missing details of additional contributions to the lines. In extreme cases stars may be found to have no emission detection despite the clear presence of an inverse P- Cygni profile, where the absorption is strong enough to make the EWint measurement uncertain. Therefore, when considering accretion in HAeBes analysis of line profiles should be used in combination with line strengths and UV-excesses (where possible), to reach a consensus on detection and origin. Such an example is presented by Cauley & Johns-Krull (2014) where their analysis of the lines profiles of the He I 10830 μm line demonstrates strong evidence of MA occurring in HAes, and perhaps from HBes too. Despite the convincing line profiles the detection rate of the line being in overall emission is low, making it a poor tracer in that regard. However, if detected in emission it can still be used to infer Ṁacc.

Despite information regarding line profiles being omitted in this work the Lacc - L_{line} relationships hold for the majority of stars and can be used as a diagnostic to infer accretion. Even the lines which have fewer detections correlate well with accretion and can be used if detected.

3.4 Objects without UV excess

One particularly interesting group of stars are those that show lines in emission, but have no detectable UV excess, ΔDB . This opens up the possibility that the emission lines could be tracing accretion where the accretion rate is below the detection limits of the Balmer excess method. This is now investigated here for the case of Hα.

The line luminosity of Hα is converted into Lacc, using the relationship determined previously and tabulated in Table 2. For this test Lacc is calculated fo the stars in which only an upper limit could be placed on the Balmer excess (25 stars, see Paper I). The derived Lacc is then converted into Ṁ_{acc} using the stellar parameters determined in Paper I.

10 J. R. Fairlamb et al.

Table 3. This table details all of the measured emission lines, along with their respective number of detections. The final four columns denote the four categories into which each star of the sample can belong to for a given line; full descriptions are provided in the text. ‘Emis’ denotes emission line, and ΔD_B denotes the UV-excess.

Line λ Line Emission No. of stars which match the criteria Number (Å) Lines Emis - Y Emis - N Emis - Y Emis - N Detected ΔD_B - Y ΔD_B - Y ΔD_B - N ΔD_B - N

1 3797 H(10-2) 42 36 27 6 22 2 3835 H(9-2) 24 22 41 2 26 3 3889 H(8-2) 22 22 41 0 28 4 4102 Hδ 23 20 43 3 25 5 4340 Hγ 37 31 32 6 22 6 4861 Hβ 81 58 5 23 5 7 5876 He I 31 28 35 3 25 8 6300 [O I] 48 34 29 14 14 9 6563 Hα 89 61 2 28 0 10 7773 O I 29 25 38 4 24 11 8446 O I 57 43 20 14 14 12 8498 Ca II 41 35 28 6 22 13 8542 Ca II 34 32 31 2 26 14 8598 Pa(14-3) 74 56 7 18 10 15 8662 Ca II 79 58 5 21 7 16 8750 Pa(12-3) 89 62 1 27 1 17 8863 Pa(11-3) 78 57 6 21 7 18 9015 Pa(10-3) 87 61 2 26 2 19 9229 Pa(9-3) 73 52 11 21 7 20 9546 Paϵ 86 61 2 25 3 21 10049 Paδ 65 48 15 17 11 22 10829 He I 40 32 31 8 20 23 10938 Paγ 71 52 11 19 9 24 12818 Paβ 78 57 6 21 7 25 15439 Br(17-4) 27 23 40 4 24 26 15556 Br(16-4) 41 32 31 9 19 27 15701 Br(15-4) 37 31 32 6 22 28 15880 Br(14-4) 33 28 35 5 23 29 16109 Br(13-4) 55 46 17 9 19 30 16407 Br(12-4) 44 36 27 8 20 31 16806 Br(11-4) 61 50 13 11 17 32 21661 Brγ 69 50 13 19 9

This, in turn, is used to predict the resulting ΔDB values. The predicted excess can be calculated via the ΔDB vs. Ṁ_{acc} curves seen in Figure 9 of Paper I.

The predicted ΔDB agrees with the upper limits measured in Paper I for 21/25 of the objects. This agreement within previous limits for the majority of these stars suggests that the lines in this work are suitable as accretion tracers for inferring Ṁacc . For the remaining 4 objects a ΔDB is predicted that is higher than the upper limits previously measured; the values lie just 1σ away from the previous limits. Considering that these fours results are only 1σ away this is not significant to detract from the previous paragraph; the accretion diagnostic properties of the lines still holds in general.

Overall, we can conclude that the “yes in emission, no in excess” criteria serves as a positive indicator that a line can be used as an accretion diagnostic line i.e. The line luminosity can be reliably used to infer the accretion rate.

4 CONCLUSIONS

This study provides the largest spectroscopic investigation into accretion rates of HAeBes to date. In addition, the spectral wavelength range covered in these stars is much larger than any other HAeBe investigation, which allows an investigation from the UV up to the NIR at 2.5 μm. The combination of a large sample, 91 objects, and huge wavelength coverage allows for the most robust statistical investigation into the emission lines in HAeBes to be performed to date.

Line luminosities were obtained for 32 different lines. The line luminosities are observed to be correlated with the accretion luminosities – by implication they are therefore correlated to the mass accretion rates. We focussed on expanding our understanding of relationships between Lacc and L_{line} in HAeBes, and how these relate to similar relationships observed in CTTs. The large size of the sample and large spectral coverage resulted in a tenfold increase in accretion line diagnostics for HAeBe stars compared to what was known in the literature.

The following key points are found:

• Relationships are obtained between Lacc and L_{line} for 32 different emission lines. In all cases a best fit is made

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II 11

Figure 4. The lines are shown by increasing wavelength along the xaxis, with their names given at the top of the plot. Each line is split into four different categories based on whether an emission line was/was not detected, and on whether ΔD_B could/could not be measured. All of the HAeBes examined are represented in this diagram. Details on the meanings of each category are provided in the text. The dash line denotes the percentage of the sample where an UV-excess is detected, 69%, and therefore the closer the green region is to this line the better the tracer. A quick glance demonstrates that Hα, Hβ, and the majority of the Paschen series are all sensitive tracers, while both He I lines and weaker Brackett lines are less sensitive accretion diagnostic lines.

to these lines, with the average correlation being Lacc ∝ L^{1.16±0.15} line . The fact that both UV excess and emission lines

were measured simultaneously make these the most robust set hitherto published.

• We find that all lines can be used as an accretion tracer. Additionally, it was shown by extrapolation, for the case of Hα, that an emission line could be used to infer low mass accretion rates which cannot normally be measured by an UV excess. This is particularly applicable for the hotter objects where their large intrinsic UV output makes the detection of weak UV excess emission difficult.

• The relationship Lacc ∝ L^{1.16±0.15}_{line} obtained for the HAeBes in this work agrees with the relationship observed in CTTs by Alcalá et al. (2014), where Lacc ∝ L^{1.08±0.08}_{line} ; the relationship is steeper for the HAeBes. On an individual line basis, some variations are seen in the relationship between the two. Notably the Ca and He lines, lines with complex line profiles that behave differently for both types of sources and warrants further investigation.

• An assessment of the sensitivity of each line as an accretion tracer has been performed though a comparison of respective emission line and UV-excess detection rates. We confirm that the well-known accretion tracers for CTTs, such as Hβ, Hα, Paβ and Brγ, are also tracers of accretion in HAeBe stars.

• The sheer number of objects and emission lines analysed here provide robust relationships between Lacc and L_{line} for an exceptional wavelength coverage. In particular, known accretion tracing lines have been further verified and new observational windows have been opened up for measuring Ṁ_{acc} in HAeBes e.g. Hβ in the blue B-band region, Paβ in the J-band region, and Br(13-4) in the H-band region. In the visible the Paschen series shows consistent sensitivity between lines. These new diagnostics will prove valuable in future observations.

• Additionally, some lines can be considered poor tracers of accretion due to a low rate incidence of detection of emission lines e.g. [O i]_{λ6300} and He I 5876 Å. However, when these lines are detected in emission they are nearly always associated with a UV-excess i.e. associated with accretion, and the relationship holds. Since this aspect is present for all lines and relationships tested here, it is likely there is a deeper physical connection. For example, in the case of [O i]_{λ6300} it is suspected that photospheric UV photodissociates OH in upper layers of the disk, giving rise to this emission (Acke, van den Ancker & Dullemond 2005).

12 J. R. Fairlamb et al.

• The high number of correlations is a topic that has been discussed recently by Mendigutía et al. (2015), where the authors found that the relationships observed between Lacc and L_{line} appear to be a consequence of them being directly related to the star’s own stellar luminosity (see also Boehm & Catala 1995). Therefore, the line luminosities may not physically arise due to accretion onto the star, but they can still serve as a diagnostic for obtaining accretion rates.

In order to gain knowledge on the physical origin of the emission lines, and their association to accretion, the line profiles themselves must be considered. Work on line profiles so far has demonstrated notable differences between CTTs and HAeBes so far (Hamann & Persson 1992a,b; Cauley & Johns-Krull 2014, 2015). Connecting these changes with both the relationships determined here, the underlying mathematical relationships (Mendigutía et al. 2015), and the large number of lines obtained with X-Shooter is the next challenge; this will will be presented in a future paper by the authors.

ACKNOWLEDGMENTS

JRF gratefully acknowledges a studentship from the Science and Technology Facilities Council of the UK. JDI gratefully acknowledges support from the DISCSIM project, grant agreement 341137, funded by the European Research Council under ERC-2013-ADG. This work has made use of NASA’s Astrophysics Data System; it has also made use of the SIMBAD database, operated at CDS, Strasbourg, France. The authors would like to extend their thanks to the anonymous referee who helped strengthen the manuscript.

REFERENCES

Acke B., van den Ancker M. E., Dullemond C. P., 2005, A&A, 436, 209 Alcalá J. M. et al., 2014, A&A, 561, A2 Bertout C., 1989, ARA&A, 27, 351 Bertout C., Basri G., Bouvier J., 1988, ApJ, 330, 350 Blondel P. F. C., Djie H. R. E. T. A., 2006, A&A, 456, 1045 Boehm T., Catala C., 1995, A&A, 301, 155 Calvet N., Gullbring E., 1998, ApJ, 509, 802 Calvet N., Muzerolle J., Briceño C., Hernández J., Hartmann L., Saucedo J. L., Gordon K. D., 2004, ApJ, 128, 1294 Castelli F., Kurucz R. L., 2004, New Grids of AT- LAS9 Model Atmospheres, ArXiv Astrophysics e-prints, arXiv:astro-ph/0405087 Cauley P. W., Johns-Krull C. M., 2014, ApJ, 797, 112 Cauley P. W., Johns-Krull C. M., 2015, ApJ, 810, 5 Cutri R. M. et al., 2003, 2MASS All Sky Catalog of point sources. NASA/IPAC Infrared Science Archive Dahm S. E., 2008, ApJ, 136, 521 Donehew B., Brittain S., 2011, ApJ, 141, 46 Eiroa C. et al., 2001, A&A, 365, 110 Eiroa, C. et al., 2002, A&A, 384, 1038 Fairlamb J. R., Oudmaijer R. D., Mendigutía I., Ilee J. D., van den Ancker M. E., 2015, MNRAS, 453, 976 Finkenzeller U., Mundt R., 1984, A&AS, 55, 109

Garrison, Jr. L. M., 1978, ApJ, 224, 535 Ghosh P., Lamb F. K., 1979, ApJ, 232, 259 Gullbring E., Calvet N., Muzerolle J., Hartmann L., 2000, ApJ, 544, 927 Gullbring E., Hartmann L., Briceno C., Calvet N., 1998, ApJ, 492, 323 Hamann F., Persson S. E., 1992a, ApJS, 82, 247 Hamann F., Persson S. E., 1992b, ApJS, 82, 285 Herbig G. H., 1960, ApJS, 4, 337 Herczeg G. J., Hillenbrand L. A., 2008, ApJ, 681, 594 Ilee J. D., Fairlamb J., Oudmaijer R. D., Mendigutía I., van den Ancker M. E., Kraus S., Wheelwright H. E., 2014, MNRAS, 445, 3723 Ingleby L. et al., 2013, ApJ, 767, 112 Kausch W. et al., 2015, A&A, 576, A78 Koenigl A., 1991, ApJL, 370, L39 Kurucz R. L., 1993, SYNTHE spectrum synthesis programs and line data. Cambridge, MA: Smithsonian Astrophysical Observatory Meeus G., Waters L. B. F. M., Bouwman J., van den Ancker M. E., Waelkens C., Malfait K., 2001, A&A, 365, 476 Mendigutía I., Calvet N., Montesinos B., Mora A., Muzerolle J., Eiroa C., Oudmaijer R. D., Merín B., 2011, A&A, 535, A99 Mendigutía I. et al., 2013, ApJ, 776, 44 Mendigutía I., Oudmaijer R. D., Rigliaco E., Fairlamb J. R., Calvet N., Muzerolle J., Cunningham N., Lumsden S. L., 2015, MNRAS, 452, 2837 Mottram J. C. et al., 2011, A&A, 525, A149 Munari U., Sordo R., Castelli F., Zwitter T., 2005, A&A, 442, 1127 Muzerolle J., Hartmann L., Calvet N., 1998, ApJ, 116, 455 Muzerolle J., D’Alessio P., Calvet N., Hartmann L., 2004, ApJ, 617, 406 Rigliaco E., Natta A., Testi L., Randich S., Alcalà J. M., Covino E., Stelzer B., 2012, A&A, 548, A56 Shu F., Najita J., Ostriker E., Wilkin F., Ruden S., Lizano S., 1994, ApJ, 429, 781 Skrutskie M. F. et al., 2006, ApJ, 131, 1163 Smette A. et al., 2015, A&A, 576, A77 Thé P. S., de Winter D., Perez M. R., 1994, A&AS, 104, 315 Uchida Y., Shibata K., 1985, PASJ, 37, 515 van den Ancker M. E., Bouwman J., Wesselius P. R., Waters L. B. F. M., Dougherty S. M., van Dishoeck E. F., 2000, A&A, 357, 325 Vernet J. et al., 2011, A&A, 536, A105 Vieira S. L. A., Corradi W. J. B., Alencar S. H. P., Mendes L. T. S., Torres C. A. O., Quast G. R., Guimarães M. M., da Silva L., 2003, ApJ, 126, 2971 Vink J. S., Drew J. E., Harries T. J., Oudmaijer R. D., 2002, MNRAS, 337, 356 Vink J. S., Drew J. E., Harries T. J., Oudmaijer R. D., Unruh Y., 2005, MNRAS, 359, 1049

APPENDIX A: ADDITIONAL LUMINOSITY RELATIONSHIPS

The sheer number of lines analysed here warrants the use of an appendix for easy reading. In here, Figure A1 displays

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II 13

the accretion luminosity versus line luminosity relationships for all 32 lines analysed (an extension of Figure 3). The bestfits to the data are present in the figure. Where possible the data on CTTs from Alcalá et al. (2014) is also included for comparison.

14 J. R. Fairlamb et al.

Figure A1. This figure shows the accretion luminosity, as calculated directly from the UV-excess, against the line luminosities. Each panel shows only the HAeBes where both a clear UV-excess and clear emission line detection are made, shown as grey squares;a best-fit to them is shown as a solid-black line (the equation for the line is given below the line descriptor in the top-left of each panel, and is also given in 2). Where applicable, the data on CTTs from Alcalá et al. (2014) is plotted for comparison, as red circles, along with their best-fit as a dashed-red line.

A spectroscopic survey of Herbig Ae/Be stars with X-Shooter II 15

Figure A1. continued.

16 J. R. Fairlamb et al.

Figure A1. continued.