arXiv:1609.03575v1 [astro-ph.IM] 12 Sep 2016

The General Assembly of Galaxy Halos Proceedings IAU Symposium No. 317, 2015 A. Bragaglia, M. Arnaboldi, M. Rejkuba, D. Romano, eds.

© 2015 International Astronomical Union DOI: 00.0000/X000000000000000X

The Milky Way’s halo in 6D: Gaia’s Radial Velocity Spectrometer performance

George Seabroke^1, Mark Cropper^1, David Katz^2, Paola Sartoretti^2, Pasquale Panuzzo^2, Olivier Marchal^2, Alain Gueguen^2, Kevin Benson^1, Chris Dolding^1, Howard Huckle^1, Mike Smith^1, Steve Baker^1

1Mullard Space Science Laboratory, University College London, Dorking, Surrey, UK 2Observatoire Paris-Site de Meudon, GEPI, Paris, France

Abstract. Gaia’s Radial Velocity Spectrometer (RVS) has been operating in routine phase for over one year since initial commissioning. RVS continues to work well but the higher than expected levels of straylight reduce the limiting magnitude. The end-of-mission radial-velocity (RV) performance requirement for G2V stars was 15 km s^{−1} at V = 16.5 mag. Instead, 15 km s^{−1} precision is achieved at 15 < V < 16 mag, consistent with simulations that predict a loss of 1.4 mag. Simulations also suggest that changes to Gaia’s onboard software could recover ∼0.14 mag of this loss. Consequently Gaia’s onboard software was upgraded in April 2015. The status of this new commissioning period is presented, as well as the latest scientific performance of the onground processing of RVS spectra. We illustrate the implications of the RVS limiting magnitude on Gaia’s view of the Milky Way’s halo in 6D using the Gaia Universe Model Snapshot (GUMS).

Keywords. techniques: radial velocities, surveys, stars: kinematics, Galaxy: halo

1. Gaia’s Radial Velocity Spectrometer performance

Gaia’s Radial Velocity Spectrometer (Cropper & Katz 2011) data are processed onground by the Data Processing and Analysis Consortium (DPAC) Co-ordination Unit (CU) 6 Spectroscopic Processing pipeline (Katz et al. 2011). The pipeline formally runs at the CU6 Data Processing Centre. We present offline tests of the CU6 pipeline running at the Mullard Space Science Laboratory. As already presented in Cropper et al. (2014), Fig. 1 (left) presents tentative evidence that the CU6 pipeline is able to achieve the end-of-mission RV precision predicted by simulations that include the straylight. The majority of the stars in Fig. 1 (left) are G dwarfs so the measured σ_{RV} ∼ 15 km s^{−1} at 15 < V < 16 mag is consistent with simulations that predict a loss of 1.4 mag.†

2. The Milky Way’s halo in 6D

The fixed limiting magnitude of G_{RV S} = 16.2 mag onboard RVS was changed to an adaptive one in September 2015. Now the limiting magnitude ranges from 15.5 < G_{RV S} < 16.2 mag as a function of time, corresponding to the straylight pattern to save telemetry on spectra that contain more noise than signal. Selecting Milky Way halo stars from the GUMS simulation (Robin et al. 2012) with G_{RV S} < 16.2 mag suggests that RVS is collecting spectra for ∼1.8 million stars in the Milky Way’s halo, the majority of which will be metal-poor giants. Having approximately verified the RV performance model in Section 1 with preliminary measurements, we apply this model to each GUMS star. This predicts an upper limit (due to the adaptive limiting magnitude) on the number of halo stars in the final Gaia catalogue with σ_{RV} < 15 km s^{−1}: ∼800,000, ∼42% of the observed halo stars (red/dark grey dots in Fig. 1 right). Fig. 1 (left) presents tentative evidence that σ_{RV} can be measured up to 30 km s^{−1}: ∼1.2 million stars, 67% of the observed halo

† http://www.cosmos.esa.int/web/gaia/science-performance 1

2 George Seabroke et al.

stars (green/light grey dots in Fig. 1 right). Beyond this limit, it has not been tested that the data follow Poisson statistics and so whether the predictions are valid.

RVS spectra were obtained with a fixed ACross Scan (AC) window width of 10 pixels. The RVS S/N simulator suggests that adapting the AC width to the observing conditions could mitigate the impact of straylight, recovering ∼0.14 mag. This would increase the aforementioned predicted upper limit to ∼900,000, a 13% increase (all Galactic components increase by several million). Gaia’s onboard software was updated in April 2015 to observe with adaptive AC widths. This new functionality has been successfully commissioned but depends very much on RVS calibrations and so is still being optimised. 3. Summary

Gaia-RVS is already the largest ever spectroscopic survey (5.4 billion spectra observed in its first year). This means it will also be the largest ever survey of the Milky Way’s halo. It will provide ∼1 km s^{−1} precision radial velocities for V < 12 mag, which is the planned CU6 contribution to the second Gaia data release (2017, to be confirmed). With Gaia astrometry, this will provide ∼10,000 local field halo stars (all Galactic components ∼2 million) in 6D. RVS spectra will also be used by DPAC CU8 to derive abundances (Fe, Ca, Ti, Si), T_{ef f} , log g, [M/H] and A_0 for V < 12 mag, ready for later data releases. CU6- measured vsini for these stars means that Gaia will measure these ∼10,000 local field halo stars and the ∼2 million all-Galactic-component stars in a total of 15 dimensions.

We present preliminary evidence that Gaia-RVS can provide ∼15 km s^{−1} precision end-of-mission radial velocities at 15 < V < 16 mag. At this precision and with Gaia astrometry, Gaia will provide ∼800,000-900,000 halo stars (all Galactic components ∼75- 100 million) in 6D in the final Gaia catalogue (2022, to be decided). When analysed with CU8-derived [M/H] from Gaia’s BP/RP spectra of these stars, Gaia’s chemo-6Dkinematic mapping out to ∼30-50 kpc from the Sun will revolutionise our understanding of the Milky Way halo’s structure, origin and evolution. References Cropper, M., & Katz, D. 2011, EAS Publications Series, 45, 181 Cropper, M., Katz, D., Sartoretti, P., et al. 2014, EAS Publications Series, 67, 69 Katz, D., Cropper, M., Meynadier, F., et al. 2011, EAS Publications Series, 45, 189 Robin, A. C., Luri, X., Reylé, C., et al. 2012, A&A, 543, A100

Figure 1. Left: Measured end-of-mission (40 transits) RV performance as a function of magnitude. Right: GUMS simulation of Milky Way halo stars with GRV S < 16.2 mag looking face on: X and Y are in the Galactic plane with the Sun at the origin (square), where the cross is the Galactic centre. Each star is colour-coded according to its predicted end-of-mission σRV , assuming every star is a metal-poor K1 giant: σRV < 15 km s^{−1} (red/dark grey), 15 < σRV < 30 km s^{−1} (green/light grey), σRV > 30 km s^{−1} (black).