arXiv:1603.07612v1 [astro-ph.HE] 24 Mar 2016

The 3^{rd} Fermi GBM Gamma-Ray Burst Catalog: The First Six Years P. Narayana Bhat^{1,12}, Charles A. Meegan^1, Andreas von Kienlin^3, William S. Paciesas^2, Michael S. Briggs^{1,12}, J. Michael Burgess^{16,17}, Eric Burns^1, Vandiver Chaplin^{1,11}, William H. Cleveland^2, Andrew C. Collazzi^8, Valerie Connaughton^{2,12}, Anne M. Diekmann^9, Gerard Fitzpatrick^{1,6}, Melissa H. Gibby^9, Misty M. Giles^9, Adam M. Goldstein^7, Jochen Greiner^{3,10}, Peter A. Jenke^{1,12}, R. Marc Kippen^{14}, Chryssa Kouveliotou^4, Bagrat Mailyan^1, Sheila McBreen^6, Veronique Pelassa^{1,13}, Robert D. Preece^{12}, Oliver J. Roberts^6, Linda S. Sparke^5, Matthew Stanbro^1, Péter Veres^1, Colleen A. Wilson-Hodge^7, Shaolin Xiong^{15}, George Younes^4, Hoi-Fung Yu^{3,10} and Binbin Zhang^1

ABSTRACT

Since its launch in 2008, the Fermi Gamma-ray Burst Monitor (GBM) has triggered and located on average approximately two γ-ray bursts (GRB) every three days. Here

1The Center for Space Plasma and Aeronomic Research (CSPAR), University of Alabama in Huntsville, 320 Sparkman Drive, Huntsville, AL 35805, USA

2Universities Space Research Association, 320 Sparkman Drive, Huntsville, AL 35805, USA 3Max-Planck-Institut für extraterrestrische Physik, Giessenbachstrasse 1, 85748 Garching, Germany 4Department of Physics, The George Washington University, 725 21st Street NW, Washington, DC 20052, USA 5Astrophysics, Science Mission Directorate, NASA HQ, 300 E Street SW, Washington, DC 20546, USA 6School of Physics, University College Dublin, Belfield, Stillorgan Road, Dublin 4, Ireland 7ZP12 Astrophysics Office, NASA-Marshall Space Flight Center, Huntsville, AL 35812, USA 8SciTec Inc., 100 Wall St., Princeton NJ, 08540, USA 9Jacobs Technology, Inc., Huntsville, Alabama, USA 10Excellence Cluster Universe, Technische Universität München, Boltzmannstr. 2, 85748, Garching, Germany 11Vanderbilt University Institute of Imaging Science, 1161 21^{st} Avenue South, Medical Center North, AA-1105, Nashville, TN 37232, USA

12Department of Space Science, University of Alabama in Huntsville, 320 Sparkman Dr., Huntsville, AL 35805 13Fred Lawrence Whipple Observatory, 670 Mount Hopkins Road, Amado AZ 85645, USA 14Los Alamos National Laboratory, MS B244, P.O. Box 1663, Los Alamos, NM 87545, USA 15Key Laboratory of Particle Astrophysics, Institute of High Energy Physics,19B Yuquan Road, Beijing, 100049, China

16The Oskar Klein Centre for Cosmoparticle Physics, AlbaNova, SE-106 91 Stockholm, Sweden 17Department of Physics, KTH Royal Institute of Technology, AlbaNova University Center, SE-106 91 Stockholm, Sweden

– 2 –

we present the third of a series of catalogs of GRBs detected by GBM, extending the second catalog by two more years, through the middle of July 2014. The resulting list includes 1405 triggers identified as GRBs. The intention of the GBM GRB catalog is to provide information to the community on the most important observables of the GBM detected GRBs. For each GRB the location and main characteristics of the prompt emission, the duration, peak flux and fluence are derived. The latter two quantities are calculated for the 50 – 300 keV energy band, where the maximum energy release of GRBs in the instrument reference system is observed, and also for a broader energy band from 10 – 1000 keV, exploiting the full energy range of GBM’s low-energy NaI(Tl) detectors. Using statistical methods to assess clustering, we find that the hardness and duration of GRBs are better fitted by a two-component model with short-hard and long-soft bursts, than by a model with three components. Furthermore, information is provided on the settings and modifications of the triggering criteria and exceptional operational conditions during years five and six in the mission. This third catalog is an official product of the Fermi GBM science team, and the data files containing the complete results are available from the High-Energy Astrophysics Science Archive Research Center (HEASARC).

Subject headings: catalogs – γ-ray burst: general

1. INTRODUCTION

Since the first γ-ray burst (GRB) was observed by the Vela satellite (Klebesadel et al. 1973), the number of flashes of high-energy radiation that have been detected has increased dramatically, especially since the 1991 launch of the Compton Gamma Ray Observatory and its γ-ray burst instrument, the Burst and Transient Source Experiment (BATSE) (Meegan et al. 1992). The GBM technique of detecting and locating GRBs is largely based on BATSE (Fishman et al. 1989), which operated from 1991 to 2000. Both instruments employ multiple sodium iodide [NaI(Tl)] detectors to achieve full sky field of view, have on-board burst triggering capability and use the relative count rates to obtain approximate directions to bursts. GBM also includes two bismuth germanate (BGO) detectors that are better suited for the detection of higher energy γ-ray photons. BATSE, with significantly larger (20^{′′} in diameter 1^{′′} thick) NaI(Tl) detectors, had better sensitivity, while GBM has a broader energy range and higher data rate.

Fermi was launched on June 11, 2008 and is now operating successfully in space for more than seven years. GBM’s main task is to augment the mission’s capability to detect and locate GRBs as well as to provide broad-band spectral information. GBM extends the energy range of the main instrument, the Large Area Telescope (LAT: 30 MeV – 300 GeV) down to the soft γ-ray and X-ray energy range (8 keV – 40 MeV). This allows for observations over more than seven decades in energy.

– 3 –

In the six years of operation since triggering was enabled on 2008 July 12, GBM has triggered 3350 times on a variety of transient events: 1405 of these are classified as GRBs (in two cases the same GRB triggered GBM twice), 198 as bursts from soft γ repeaters (SGRs), 469 as terrestrial γ-ray flashes (TGFs), 795 as solar flares (SFs), 304 as charged particle (CPs) events, and 179 as other events (Galactic sources, accidental statistical fluctuations, or too weak to classify). Table 1 shows a breakdown of the observed event numbers sorted by the time periods covered by the first GBM burst catalog (2008 July 12 to 2010 July 11) (Paciesas et al. 2012), the second GBM catalog (2010 July 12 to 2012 July 11) (von Kienlin et al. 2014) and the additional two years included in the current catalog (2012 July 12 to 2014 July 11) again separated according to the event type. In addition, the number of Autonomous Repoint Requests (ARRs, described in Section 2.2 below) and GRBs detected by LAT, observed with high confidence above 100 MeV (and 20 MeV), are given (Ackermann et al. 2013). The preliminary results of the GBM team analyses for bright bursts and those bursts simultaneously detected by other satellite instruments are reported in the Gamma-ray Coordinates Network (GCN) circulars^1, a very effective way of informing the GRB research community of the initial properties of GRBs. Here we present the final results after a careful analysis of the full set of burst data using detector response functions for the best available burst location. This catalog lists for each GRB the location and the main characteristics of the prompt emission, the duration, peak flux and fluence. In addition, the distributions of these derived quantities for the entire 6 year period are also presented.

The upcoming GBM spectral catalog^2 provides information on the systematic spectral analysis of nearly all GRBs listed in the current catalog, including time-integrated fluence and peak flux spectra. A new catalog of time resolved spectral analysis of bright GRBs of the first 4 years has also been compiled (Yu et al. 2015).

In §2.1 and 2.2 we briefly describe the GBM detectors and the GBM GRB localization technique together with a description of the onboard triggering algorithms and the path of trigger information dissemination. Furthermore a brief description of the GBM data products is presented. Section 2.3 reports the GRB trigger statistics of the first six years, comparing them with the triggers on other event classes. Major changes in operational conditions occurring during years 5 & 6 are also mentioned. A summary of the major steps of the catalog analysis is given in §3. The catalog results are presented in §4 and are discussed in §5. Finally, in §6 we conclude with a summary.

1 http://gcn.gsfc.nasa.gov/

2GBM 8 Year Spectroscopy Catalog, in prep.

– 4 –

2. FERMI GAMMA-RAY BURST MONITOR

2.1. GBM Detectors

The capability of GBM to detect and locate GRBs in the energy range of the maximum energy release in the observer reference system and to provide energy overlap with that of the main instrument (LAT) is achieved by the use of two different types of inorganic scintillation detectors. In the energy range from 8 keV to 1 MeV, 12 thallium-doped sodium iodide detectors [NaI(Tl)], each of which is attached to a 5^{′′} photomultiplier tube (PMT), are used. The NaI(Tl) detectors are each 1.27 cm thick by 12.7 cm diameter and are deployed around the spacecraft in such a way that each detector observes the sky at a different inclination, providing visibility of the entire sky unocculted by the Earth. The relative count rates of the NaI detectors, which have a quasi-cosine response, are used to determine the locations of triggered GRBs. The location of a GRB is calculated by comparing the measured background-subtracted count rates in individual detectors with a lookup table, containing a list of relative detector rates for a grid of simulated sky locations of γ-ray point sources.

The on-board and on-ground lookup tables have resolutions of 5 degrees and 1 degree, respectively. With this method the limiting accuracy is approximately 8 degrees for on-board locations and approximately 4 degrees for on-ground locations. A detailed investigation of the GBM location accuracy can be found in Connaughton et al. (2015).

For the detection of the prompt γ-ray emission in the MeV-range, between ∼ 200 keV and 40 MeV, detectors employing the high density scintillation crystal Bismuth Germanate (BGO) are used. Two detectors using large cylindrical BGO crystals, 12.7 cm diameter by 12.7 cm thick, each coupled to two 5^{′′} photomultipliers, one on each end, are mounted on opposite sides of the spacecraft, allowing observations of the full unocculted sky and providing spectral information up to tens of MeV regime for all GBM detected bright and hard GRBs. The GBM instrument is described in more detail in Meegan et al. (2009).

2.2. Triggering and Post-trigger Operations

The GBM Flight Software (FSW) continuously monitors the detector count rates to detect GRBs and other short-timescale transients. A burst trigger occurs when the FSW detects an increase in the count rates of two or more NaI(Tl) detectors above a preset but adjustable threshold specified in units of the standard deviation of the background rate. The background rate is an average rate accumulated over the previous 17 seconds, excluding the most recent 4 s. Energy ranges are confined to combinations of the eight channels of the CTIME data (Meegan et al. 2009). Trigger timescales may be defined as any multiple of 16 ms up to 8.192 s. Except for the 16 ms timescale, all triggers include two phases offset by half of the accumulation time, which has been suggested to be optimal (Band 2002). A total of 120 different triggers can be specified, each with a

– 5 –

distinct threshold. The trigger algorithms currently implemented include four energy ranges: the BATSE standard 50 - 300 keV range, 25 - 50 keV to increase sensitivity for SGRs and GRBs with soft spectra, > 100 keV, and > 300 keV to increase sensitivity for hard GRBs and TGFs (Fishman et al. 2011). Ten timescales, from 16 ms to 8.192 s in steps of a factor 2, are implemented in the 50 - 300 keV range and the 25 - 50 keV range. The > 100 keV trigger excludes the 8.192 s timescale, and the >300 keV trigger has only four timescales, viz. 16, 32, 64 and 128 ms. The concept of the trigger algorithm was adopted from BATSE, but with added algorithms running in parallel. The large number of algorithms and flexibility has made it is possible to investigate whether the population of GRBs observed by BATSE was actually biased by the latter’s limited number of trigger algorithms. This also adds an improvement in the GBM trigger sensitivity (Band 2002; Band et al. 2004). The standard setting of the offset is half the timescale of the original algorithm as mentioned above. A summary of the actual settings (by July 2014) and the changes in the first six years of the mission is shown in Table 2.

Since GBM triggers on a variety of astrophysical transients in addition to GRBs, the FSW performs an automatic event classification by using a Bayesian approach that takes into account (i) the event localization, (ii) spectral hardness, and (iii) the spacecraft geomagnetic latitude (Meegan et al. 2009). This information is very important and useful for the automated follow up observations. Furthermore the capabilities of the instrument to detect events other than GRBs were improved by tuning dedicated trigger algorithms using refined Bayesian priors.

Following a trigger some important parameters that are needed for rapid ground-based followup observations, i.e., onboard preliminary localization, event classification, burst intensity and background rates, are downlinked as TRIGDAT data by opening a real time communication channel through the Tracking and Data Relay Satellite System (TDRSS). In addition, these data are used in near real-time by the Burst Alert Processor (BAP), redundant copies of which are running at Goddard Space Flight Center (GSFC) and at the GBM Instrument Operations Center (GIOC) at the National Space Science and Technology Center (NSSTC) in Huntsville, Alabama. Relative to the GBM FSW, the BAP provides improved locations, since it uses a finer angular grid (1 degree resolution) and accounts for differences in the burst spectra and more accurately for atmospheric and spacecraft scattering. Users worldwide are informed within seconds about the flight and automatic ground locations and other important parameters by the automatic dissemination of notices via the GCN as mentioned before. The GBM burst advocates (BA), working in alternating 12 hr shifts at the GIOC and collaborating institutions in Europe, including the operations center MGIOC at the Max Planck Institute for Extraterrestrial Physics (MPE) in Garching, Germany, use the TRIGDAT data to promptly confirm the event classification and generate refined localizations by applying improved background models and detector response functions. Unless a more precise localization of the same GRB has been reported by another mission, a GCN notice with the final position and classification is sent out by the BA. In addition, the BAs compute preliminary durations, peak fluxes, fluences and spectral parameters, and report the results in a GCN circular in case of a bright event or a GRB that was already detected by another instrument.

– 6 –

The GBM FSW promptly notifies the LAT of trigger times and locations of triggered GRBs as well as their preliminary classifications in order to launch dedicated onboard burst search algorithms for the detection of possible high-energy emission. In case of a sufficiently intense GRB, which exceeds a preset threshold for peak flux or fluence, a request for an ARR of the spacecraft is transmitted to the LAT and forwarded to the spacecraft FSW. Acceptance of the ARR by the spacecraft FSW initiates a special observation mode that maintains the burst location in the LAT field of view for an extended duration (currently 2.5 hours, subject to Earth limb constraints), to search for delayed high-energy emission. Table 1 lists the total number of ARRs which occurred in the first six years and the table 5 identifies those GRBs for which the GBM FSW issued an ARR.

The continuous background count rates recorded by each detector are downlinked as two complementary data types, the 256 ms high temporal resolution CTIME data with 8 energy channels and the low temporal resolution (4 s) CSPEC data with full spectral resolution of 128 energy channels that are used for spectroscopy. The lookup tables (LUTs) are used by the GBM FSW to define the boundaries of the CTIME and CSPEC spectral energy channels from the 4096 ADC channels. There are two CSPEC LUTs, one for the NaI(Tl) detectors and one for the BGO detectors. The current LUTs are pseudo-logarithmic so that spectral channel widths are commensurate with the detector energy resolution as a function of γ-ray energy. In case of an on-board trigger, the temporal resolutions of CTIME and CSPEC data are increased to 64 ms and 1 s, respectively, a mode lasting nominally for 600 s after the trigger time.

Moreover, high temporal and spectral resolution data are downlinked for each triggered event. These time-tagged event (TTE) data consist of individual photon arrival times with 2 μs temporal resolution and 128 channel spectral resolution from each of the 14 GBM detectors, are recorded for 300 s after and about 30 s before each trigger. The benefit of this data type is the flexibility to adjust the temporal resolution to an optimal value with sufficient statistics during analysis. Beginning on November 27, 2012, TTE data have been generated continuously throughout the orbit except during Fermi passage through South Atlantic Anomaly (SAA, see section 2.4 for more details).

2.3. Trigger Statistics

The GBM instrument, which is primarily designed to detect cosmic GRBs, additionally detects bursts originating from other cosmic sources, such as Solar Flares (SFs) and SGRs, as well as extremely short but spectrally hard TGFs observed from the Earth’s atmosphere, which have been associated with lightning events in thunderstorms. Table 1 summarizes the numbers of triggers assigned to these additional event classes, showing that their total number is of the same order as the total number of triggered GRBs. Approximately 10% of the triggers are due mostly to cosmic rays or trapped particles; the latter typically occur in the entry or exit regions of the SAA or at high geomagnetic latitude. In rare cases, outbursts from known Galactic sources have caused triggers. Finally, ∼ 6% of the GBM triggers are generated accidentally by statistical fluctuations or are too weak to be confidently classified. The quarterly trigger statistics over the six years of the mission

– 7 –

are graphically represented in Figure 1. The rate of GRBs is slightly lower in the second two years because at the beginning of 2011 July triggers were disabled during times when the spacecraft was at high geomagnetic latitude. The McIlwainL parameter, which is used by the FSW as a threshold for disabling triggering, has been raised from 1.58 to 1.9 since year 5 while the McIlwain L threshold for disabling ARR has been retained at 1.58.

It is evident from Figure 1 that the major bursting activity from SGR sources took place in the beginning of the mission, mainly in 2008 and 2009. In addition to emission from previously known SGR sources (von Kienlin et al. 2012; van der Horst et al. 2012; Lin et al. 2011), GBM also detected a new SGR source (van der Horst et al. 2010). It is also obvious from the figure that the rate of monthly detected triggers on TGF events has increased by a factor of ∼ 8 to about two per week, after the upload of the new FSW version (V2.6) on November 10, 2009 (Briggs et al. 2013). This version includes additional trigger algorithms that monitor the BGO detector count rates in the 2 – 40 Mev energy range (see Table 2). This has two advantages: firstly the TGF bursts show very hard spectra up to 40 MeV and hence BGO detectors have a better sensitivity for TGFs, and secondly the deadtime in the NaI(Tl) detectors is much larger for γ-rays of energy ≥1 MeV^3 (Briggs et al. 2013).

Table 3 summarizes first trigger algorithm that triggered on bursts or flares from the different object classes. Once a trigger has occurred the FSW continues to check the other trigger algorithms and ultimately sends back the information in TRIGDAT data as a list of trigger times for all algorithms that were satisfied. This detailed information was used in Paciesas et al. (2012) to investigate the apparent improvement in trigger sensitivity relative to BATSE. It was found that mainly GBM’s additional longer trigger timescales triggers (> 1.024 s) in the 50 to 300 keV energy range were able to detect GRB events which wouldn’t have triggered the BATSE experiment. These observations are confirmed by analyzing the current full 6 year dataset.

Furthermore we ascribe the improved trigger sensitivity of GBM to lower trigger threshold of 4.5σ − 5.0σ (see Table 2) compared to the BATSE settings of 5.5σ (see Table 1 in Paciesas et al. 1999). The longest timescale trigger algorithms in the 50 - 300 keV energy range, running at ∼ 16 s (20, 21) and ∼ 8 s (18, 19) were disabled in the beginning of the mission (see Table 2), since no event triggered algorithms 20 & 21 and only three GRBs triggered on algorithms 18 & 19. The algorithms running on energy channel 2 (25 -50 keV) with timescales higher than 128 ms were disabled, since they were mostly triggered by non GRB (and non SGR) events. The short timescale algorithms in the 25 - 50 keV energy range (22 - 26) were retained, mainly for the detection of SGR bursts, which are short and have soft energy spectra. Even these triggers were disabled during periods of high Solar activity (see table 4). The new algorithms above 100 keV didn’t increase the GRB detection rate. They were disabled with the exception of the shortest timescale algorithms running at 16 ms, particularly suitable for the detection of TGFs. Table 2 clearly shows the capabilities of the newly

3γ-rays of energy > 1 MeV will be registered in the overflow channel of the NaI(Tl) spectrum which have 10 times larger deadtime.

– 8 –

introduced “BGO”-trigger algorithms 116 -119 for TGF detection.

2.4. GBM Flight Software Upgrade: Year five and six

As in previous years, the GBM instrument trigger configuration was temporarily changed in three ways that affected the GRB data: 1) some or all of the trigger algorithms were disabled, and 2) the low-level energy thresholds (LLT) were raised on the Sun-facing detectors (NaI 0-5) and 3) the soft triggers (i.e. trigger algorithms 22-26) were disabled every weekend Friday 15-20h UT to 13-20h UT Monday for durations anywhere between 60 to 120 hrs. This was to mitigate the generation of excessive TTE data during possible solar activity over the weekends^4. During years 5-6 Fermi conducted a series of nadir-pointing observations to allow the LAT to detect possible > 100 MeV photons during a TGF. In order to avoid spacecraft reorientation due to a possible ARR from GBM FSW, GRB triggers were disabled during these nadir observations. During these intervals TTE data generation was turned on continuously so that a sensitive search for GBM TGFs coincident with the LAT as well as untriggered GRBs, if any, could be performed. Again, in order to mitigate unacceptably high rates of TTE, the LLTs in the Sun-facing NaI(Tl) detectors were raised above the nominal as summarized in table 4.

The hardware design limits the data available to the flight computer for triggering to data binned at temporal resolutions of 16 ms and longer. Hence the onboard triggering of GBM has reduced sensitivity compared to the capabilities of the detectors because the 16 ms minimum resolution of the data used for triggering is much longer than the duration of most TGFs of about 0.1 ms, which adds unnecessary background data and reduces the trigger sensitivity. As mentioned above, the GBM TTE data type records the energies and arrival times of individual photons with 2μs temporal resolution, 2-5 μs absolute accuracy, and an energy resolution of 128 pseudologarithmic channels. The continuous TTE coverage could enhance the capability of the ground software to detect short untriggered GRBs that could potentially be coincident with a gravitational wave signal detected by LIGO (Matichard, et al. 2015). Aforesaid limitations could be circumvented by downlinking the GBM photon data as continuous TTE data and by conducting a ground-based search for TGFs and untriggered GRBs. However, early in the mission producing this data type continuously would have exceeded the original telemetry allocation of GBM. Because of its potential, increased telemetry was provided to support TTE production for a portion of the Fermi orbit each day (FSW V2.6) beginning 9 July 2010. To use this resource most effectively, continuous (i.e., non-trigger) TTE data were produced in regions where high TGF activity was expected. Polygonal geographic regions were defined. TTE data production was commanded on when Fermi entered one of these regions and commanded off when Fermi exited. This mode of operation continued until 26 November 2012, at which time the continuous TTE data mode was extended to the entire

4A table summarizing the intervals of non-nominal trigger settings is posted at:

http://fermi.gsfc.nasa.gov/ssc/data/access/gbm/llt_settings.html

– 9 –

orbit outside of the SAA. The increased sample size and improved exposure uniformity increased the usefulness of Fermi for studies of TGF properties and TGF-meteorological correlations. The rate of detection of TGFs increased to nearly 850 per year (Briggs et al. 2013). The continuous TTE coverage enhanced the astrophysics capabilities of GBM as well (Aasi et al. 2014).

This new provision of the continuous TTE data production has the potential of producing excessive data that is not very useful during bright Solar Flares. To guard against this, a provision to suspend the TTE data production from the Sun-facing GBM detectors (NaI 0-5 and BGO0) was included in GBM FSW version 2.7, which was uploaded on 25 November 2012. In this version the total count rates from all 14 GBM detectors are continuously monitored by the FSW. If the total rate exceeds a threshold value, the TTE data production from the Sun-facing detectors is suspended while the other detectors continue TTE data production. The TTE data production by the Sun-facing GBM detectors resumes once the total rate falls below the threshold value and remains so for a preset time duration. The FSW parameters that are used to regulate the TTE data production may be changed by FSW commands.

2.5. Trigger Status Modifications during Year 5 & 6

Normal triggering criteria were changed under certain circumstances, such as increased solar activity when a large volume of TTE data are produced. In order to mitigate the possibility of filling the onboard hard disk, we disabled low energy triggers (trigger algorithms 22-26). However, if the flare is soft and yet very intense it could also trigger on higher energy algorithms during intense Solar Flares. To mitigate such cases we also raised the threshold of the Sun-facing detectors (NaI 0-5) (see table 4 for time duration of such changes).

As noted above, during this period Fermi was periodically run in a special mode in which the spacecraft was inverted to view the nadir. Each nadir observation lasted for about 2-3 hours (see table 4). In order to prevent an unexpected ARR from reorienting the spacecraft during nadir observations, we disabled GRB triggers. All the times and types of such GBM GRB trigger criteria modifications, are listed in table 4.

3. ANALYSIS RELATING TO THE PRESENT GRB CATALOG

The GBM GRB catalog analysis process is described in detail in the first and second catalog papers (see appendix of Paciesas et al. (2012); von Kienlin et al. (2014)). Here we briefly summarize the major analysis steps.

– 10 –

3.1. Burst Localization and Detector Response Matrix

The GRB locations listed in Table 5 are adopted from the BA analysis results, uploaded to the GBM trigger catalog at the GIOC (with a copy at the Fermi Science Support Center, FSSC^5). Better locations, if any, for bursts that were detected simultaneously by any other γ-ray instrument, such as Swift(Barthelmy et al. 2005) or INTEGRAL (Basano, et al. 2003), or were localized more precisely by the Inter Planetary Network (IPN, Hurley et al. 2013) are also listed in the table. The determination of a reliable location is quite important since all analysis results depend on the response files generated for the particular GRB location.

GRB locations shown in Table 5 were produced using version 4.15 of the localization code. The GBM location uncertainties shown in the table are the circular area equivalent of the statistical uncertainty (68% confidence level). The source localization algorithm has not changed since the production of the last GRB catalog, and is detailed therein. The accuracy of the locations has been assessed using a reference sample of 200 GRBs localized by other instruments and 100 GRBs localized through the IPN. We find the distribution of systematic uncertainties for GRBs is well represented (at 68% confidence level) by a Gaussian (of standard deviation 3.7^∘) with a non- Gaussian tail that contains about 10% of GBM-detected GRBs and extends to approximately 14^∘(Connaughton et al. 2015). A more complex model suggests that there is a dependence of the systematic uncertainty on the position of the GRB in spacecraft coordinates, with GRBs in the quadrants on the Y-axis better localized than those on the X-axis. A convolution of the statistical uncertainty with our best current model for the systematic errors produces probability maps reflecting the total uncertainty on a GBM GRB location. The maps reflect the occasional non-circular shapes of the statistical uncertainty region as well as its area. They have been packaged into new data products (ASCII, FITS, png) that have been routinely delivered to the FSSC since January 2014 and have now been processed and delivered for the GRBs prior to 2014. Because the generation of these new data products requires re-running the localization code, which has recently been automated, the actual GRB locations in the GRB catalog at the FSSC may be different from those published in the first two catalogs. The new locations are consistent, within errors, with the old locations, but the manual processing may use different background and source intervals than those selected in the automatic process.

Detector Response Matrices (DRMs) generated using the General Response Simulation System (GRESS) (Hoover, et al. 2005), agree with the data from the detector-level calibrations as a function of angle and energy within better than ± 5% for the BGO detectors, and ± 10% for the NaI(Tl) detectors. The DRMs, which contain the multivariate effective detection area, include the effects of angular dependence of the detector efficiency, partial energy deposition in the detector, energy dispersion and nonlinearity of the detector, and atmospheric and spacecraft scattering (and shadowing) of photons into the detector, partial or complete blockage of GBM detectors by the

5http://heasarc.gsfc.nasa.gov/FTP/fermi/data/gbm/bursts/

– 11 –

LAT or the radiators. They are therefore functions of photon energy, measured (deposited) energy, the direction to the source with respect to the spacecraft, and the orientation of the spacecraft with respect to the Earth. Individual DRMs needed for analysis of the science data were generated for the best available location using version GBMRSP v2.0 of the response generator and version 2 of the GBM DRM database. Two sets of DRMs are generated, one for 8-channel (CTIME) data and one for 128-channel (CSPEC & TTE) data. In case of relatively long duration GRBs multiple DRMs are used, which provide a new DRM for every 2^∘ slew of the Fermi satellite (RSP2).

3.2. GRB Duration, Peak Flux and Fluence

Analysis of GBM data products is fundamentally a process of hypothesis testing wherein trial source spectra and locations are converted to predicted detector count histograms, and these are statistically compared to the observed data. GBM uses a special burst spectroscopy software package called RMFIT^6. Here we report the duration, peak flux and fluence of each burst using an automatic batch fit routine implemented within RMFIT. Burst durations T_{50} (T_{90}) are determined from the interval between the times where the burst has reached 25% (5%) and 75% (95%) of its maximum fluence, as illustrated by the horizontal and vertical dashed lines in figure 3. The burst durations T_{50} and T_{90} were computed in the 50-300 keV energy range. This is primarily due to the fact that GRBs have their maximum spectral density in this energy range. In addition, this energy range makes it easier to compare the present results with those of the predecessor BATSE. It may be noted that GRB durations have been shown to have a power-law dependence on energy (Qin et al. 2013). The fluence for each burst was computed in two energy ranges: 50-300 keV and 10-1000 keV. Peak fluxes for each burst were computed in the same energy ranges and for three different timescales: 64 ms, 256 ms and 1024 ms. Since a relatively small number of bursts have detectable emission in the BGO detectors, only NaI(Tl) data were used for the catalog analysis.

For each burst, a set of NaI(Tl) detectors were chosen with low source angles (typically < 60^∘) and no apparent blockage by any other GBM detector, or LAT or the LAT radiators. For the majority of bursts the GBM CTIME data, which have 256 ms time resolution pre-trigger and 64 ms resolution post-trigger, were used. TTE data were used for bursts where at least one of the peak fluxes occurs at or before the trigger time, which happens for many short bursts and a few longer ones. For each of the selected detector illuminated by a burst, source and background time intervals are then selected. The source interval covers the burst emission time plus approximately equal intervals of background before and after the burst (generally at least ∼ 20 s on either side for long GRBs while it is ∼ 5 s or shorter for short GRBs). Background intervals are selected before

6We used the spectral analysis package RMFIT, which was originally developed for time-resolved analysis of BATSE GRB data but has been adapted for GBM and other instruments with suitable FITS data formats. The software is available at the Fermi Science Support Center: http://fermi.gsfc.nasa.gov/ssc/data/analysis/user/ A tutorial is also available at http://fermi.gsfc.nasa.gov/ssc/data/analysis/scitools/rmfit_tutorial.html

– 12 –

and after the burst, about twice as wide as the burst duration and having a good overlap with the selected source interval before and after the burst as shown in figure 2. Background regions before and after the burst are fit by a polynomial of up to 4^{th} order, separately for each detector. Depending on the background fluctuations, the lowest order polynomial that gives a good fit is chosen. The background subtracted counts spectrum of each time bin in the source interval is fit to a model incident photon spectrum by folding the photon spectrum with the DRM and minimizing the CSTAT^7. For the T_{90} analysis, the incident model spectrum is “Comptonized” (COMP) photon model: f_{COMP} (E) = A ( E E_{piv} )_α exp [ − (α + 2) E E_{peak} ] , The best fit parameters are: amplitude A, the low energy spectral index α and peak energy E_{peak} (the parameter E_{piv} is fixed to 100 keV).

Figure 2 shows the light curve as measured by a single NaI(Tl) detector of a relatively long burst consisting of multiple emission periods, with the selected source and background intervals highlighted. Figure 3 shows a plot of the integrated GRB fluence in the 50 – 300 keV energy range derived from the model fitting for all time bins within the source interval. Several short duration plateaus seen in figure 3 are the time intervals where no burst emission is observed. This function is used to determine the T_{50} (T_{90}) burst duration from the interval between the times where the burst has reached 25% (5%) and 75% (95%) of its total fluence, as illustrated by the horizontal dashed lines.

Peak fluxes and fluences are obtained in the same analysis, using the same choices of detector subset, source and background intervals and background model fits. The peak flux is computed for three different time intervals: 64 ms, 256 ms and 1.024 s in the energy range 10 – 1000 keV and, for comparison purposes with the results presented in the BATSE catalog (Meegan et al. 1998), in the 50 – 300 keV energy range. The burst fluence is also determined in the same two energy ranges. The RMFIT analysis results presented above are stored in a BCAT fits file: glg bcat all bnyymmddttt vxx.fit with specified wildcards for the year (yy), month (mm), day (dd), fraction of a day (ttt) and version number (xx).

4. GRB CATALOG RESULTS

The catalog results can be accessed electronically through the HEASARC browser interface at http://heasarc.gsfc.nasa.gov/W3Browse/fermi/fermigbrst.html. Here we provide tables that summarize selected parameters.

Table 5 lists the 1405 triggers of the first six years that were classified as GRBs. The GBM Trigger ID is shown along with a conventional GRB name as defined by the GRB-observing commu-

7http://heasarc.nasa.gov/docs/xanadu/xspec/XspecManual.pdf

– 13 –

nity. Note that the entire table is consistent with the small change in the GRB naming convention that became effective on 2010 January 1 (Barthelmy et al. 2009): if for a given date no burst has been “published” previously, the first burst of the day observed by GBM includes the ‘A’ designation even if it is the only one for that day. For year 5 & 6, only GBM triggered GRBs for which a Gamma-ray burst Coordinates Network (GCN) Circular was issued are assigned a GRB name. The criterion for issuing a GBM Circular is if a GRB was either detected by any other mission (as listed in the last column of table 5 ) or it generated an ARR to the Fermi spacecraft or the count rate in the 50-300 keV energy range summed over the triggered detectors exceeded 1000 counts per second above the background. The third column lists the trigger time in Universal Time (UT). The next four columns of Table 5 list the sky location and associated statistical error^8, along with the instrument that determined the location. The table also lists the GBM-derived location only if no higher-accuracy locations have been reported by any other instrument. If a higher-accuracy location is available its source is listed under the column ‘Location Source’ which lists only the name of the mission rather than the specific instrument onboard that mission (e. g., Swift implies the locations are either from Swift-BAT or Swift-XRT or Swift-UVOT); The errors on the GRB locations determined by other instruments are not necessarily 1 σ values. For the GBM analysis, location accuracy better than a few tenths of a degree provides no added benefit because of significant systematic errors in GBM location (Connaughton et al. 2015). Table 5 also shows which algorithm was triggered along with its timescale and energy range. Note that the listed algorithm is the first one to exceed its threshold but it may not be the only one. The table also lists other instruments that detected the same GRB^9. Finally, we identify the GBM GRBs for which an ARR was issued by the GBM FSW in the last column of table 5. We have a total of 93 GRBs (6.6% of the total) followed by ARRs during the first 6 years of Fermi, although the spacecraft might not have slewed in every case for technical reasons such as Earth limb constraints. The majority of these ARRs were due to high peak fluxes. In addition, there were 26 ARRs which were issued for non-GRB triggers because of the mis-classification by the GBM FSW.

The results of the duration analysis are shown in Tables 6, 7 & 8. The values of T_{50} and T_{90} in the 50–300 keV energy range are listed in Table 6 along with their respective 1 σ error estimates (Koshut et al. 1996) and start times relative to the trigger time. For a few GRBs the duration analysis could not be performed, either because the event was too weak or due to technical problems with the input data. Also, it may be noted that the duration estimates are only valid for the portion of the burst that is visible in GBM light curves summed over those NaI(Tl) detectors whose normals make less than 60^∘to the source. If the burst was partially occulted by Earth or had significant emission while GBM detectors were turned off in the SAA region, the “true” durations may be underestimated or overestimated, depending on the intensity and variability of

8For GBM derived locations the statistical 1 σ error is given. The GBM errors are not symmetric and the given value is the average of the error ellipse.

9This information was drawn from the GCN archive, accessible at http://gcn.gsfc.nasa.gov/gcn3_archive.html. A more complete list of detections is available at http://www.ssl.berkeley.edu/ipn3/masterli.txt.

– 14 –

the undetected burst emission. GRBs which triggered while Fermi was close to SAA or the trigger is unusual in any other way, are indicated in table 5 with a footnote. For technical reasons it was not possible to do a single analysis of the unusually long GRB091024A (Gruber et al. 2011) and GRB130925A, so the analysis was done separately for the two triggered episodes. Similarly GRB130925A (Greiner et al. 2014; Evans et al. 2014) also had 3 emission episodes well separated in time, for which GBM triggered on the first 2 episodes. These cases are also noted in the table 5. The reader may note that for most GRBs the present analysis used data binned no finer than 64 ms, so the duration estimates (but not the errors) are quantized in units of 64 ms. However for a few extremely short events TTE/CTTE data were binned with widths of 32 ms or even 16 ms in a few cases. As a part of the duration analysis, peak fluxes and fluences were computed in two different energy ranges. Table 7 shows the values in 10-1000 keV and Table 8 shows the values in 50–300 keV. The analysis results for low fluence events are subject to large systematic errors primarily because they use 8-channel spectral data and should be used with caution. The fluence measurements in the spectroscopy catalog (Gruber et al. 2014), which uses the 128-channel CSPEC or TTE data, are more reliable for such weak events.

5. DISCUSSION

Figure 4 shows the sky distribution of GBM triggered GRBs in Galactic coordinates. Crosses indicate long GRBs (T_{90} > 2 s); asterisks indicate short GRBs. Both the long and short GRB locations do not show any obvious anisotropy, consistent with an isotropic distribution of GRB arrival directions. Also shown are the locations of GRBs that triggered Swift-BAT in coincidence with GBM. Many of these Swift coincident GRBs also have redshifts estimated by detecting the optical afterglows by ground based telescopes.

The histograms of the logarithms of GBM triggered GRB durations (T_{50} and T_{90}) are shown in Figure 5. Using the conventional division between the short and long GRB classes (T_{90} ≤ 2 s and T_{90} > 2 s respectively) we find that during the first 6 years there were 229 short GRBs and 1175 long GRBs. The short and long GRBs, as defined by their T_{90} in 50-300 keV, possibly belong to two different classes Kouveliotou et al. (1993). However from the T_{90} distribution shown in figure 5 the distinction seems to be less than obvious. There are also several claims in the literature on the existence of 3 types of GRBs based on multiple GRB parameters like duration, fluence, spectrum, spectral lag, peak-count rate etc., from BATSE sample (Mukherjee et al. 1998; Horvath, et al. 2006), Swift sample (Veres et al. 2010) as well as RHESSI sample (R̆ipa et al. 2012). The 3 groups are the familiar short-hard GRBs, long-soft GRBs and a soft-intermediate duration GRBs bridging the other two groups. Hence we decided to independently assess the number of groups in GRB durations ( T_{90} and T_{50}) as well as duration-hardness distributions by a model based clustering method using lognormal model components (‘mclust’ Fraley & Raftery 2000). This method uses a binning-independent maximum likelihood function with correction for the degrees of freedom, called Bayesian Information Criterion (BIC). We find that both the log T_{50} and log T_{90} distributions are

– 15 –

best described by two components with equal variance (see Fig 6). The difference in BIC values between two and three components is 12 for T_{50} and ∼ 15 for T_{90} (see Figure 6), both suggesting a strong preference for two groups of GRBs in the present sample. Figure 5 also shows the lognormal fits separately to long and short GRBs. The variances of the lognormal components are constrained to be equal for each group. The goodness of fit is estimated by Kolmogorov-Smirnov test that yields a probability of 0.745 and 0.796 in favor of the null hypothesis (data and model are drawn from the same distribution) for T_{90} and T_{50} distributions respectively.

In addition to quantify the extent to which 2 groups are preferred compared to 3 populations statistically, we have carried out Monte Carlo simulations. First, we simulated 10^5 instances of T_{90} and T_{50} with the best 2 group solution. We found that in 16 (p = 1.6×10^{−4}) and 24 (p = 2.4×10^{−4}) cases respectively the 3 group solution was preferred. To gauge the significance of the 3 group solutions we have simulated 10^4 instances with the best 3 group solution for both T_{90} and T_{50}. We found that a three group solution was only preferred in 3 and 41 cases respectively. This indicates that in the three group solution, the third group is not clearly distinguished.

Because the GRB groups have less overlap if we consider more than one dimension, we consider the hardness in addition to duration (discussed later in this section). We use only those bursts that have hardness errors less than the hardness value. We end up with a sample size of 1222. Using the BIC analysis again, we find that similar to the one dimensional distribution of durations, the duration-hardness data are also best described by two groups (see figure 8). In figure 8 the ellipses mark the one sigma contours of the two dimensional Gaussians. They encompass ≈ 0.39 of the volume of the individual components (this is analogous to the 0.68 fraction marking the one sigma region in the one dimensional Gaussian case). We find that 40.1% and 39.8% GRBs are contained within the ellipses for the short and long cases respectively, consistent with the expectations. The difference between the best 2 and 3 group solutions is 4.6 and 8.9 for the T_{90} − HR (bottom) and T_{50} − HR (top) distributions respectively. In the parlance of the BIC values, these constitute strong evidence for the 2 group solution. In order to have a more quantitative assessment we, again, have simulated distributions with the best 2 group solution and found 0 cases in 10^3 trials (p < 10^{−3}) and 3 (p = 3 × 10^{−3}) cases where the 3 group solution was preferred in the T_{90} − HR and T_{50} − HR distributions respectively. In the case of T_{90} − HR distribution the best model has ellipsoidal components with equal volumes and shapes, but their orientation is free to vary (figure 9 black solid line). For T_{50} − HR distribution the best model also has ellipsoidal components while their volumes, shapes and orientations are constrained to be equal (figure 9 black solid line). In short, the model-based clustering method applied to hardness ratios and durations unveils only two clusters as the best solution: classical short/hard and long/soft groups consistent with a similar analysis carried out on the RHESSI data (R̆ipa et al. 2012).

Using an entirely independent approach to estimate the number of populations that can exist in the observer-frame T_{90} distribution, we employ a Bayesian Dirichlet mixture model composed of Gaussians (see Gershman and Blei 2012). This enables us to ask the question how many subpopulations exist rather than asking whether three populations fit the data better than two popu-

– 16 –

lations. We use an approach similar to that followed by Chattopadhyay et al. (2007) except that we adopt a hierarchical Bayesian approach which allows us to leave the concentration as a free parameter in the model. The model returns posterior distributions of the probability for each subpopulation that is found. We find that there are two significant Gaussian sub-populations with 95% highest density intervals for their existence covering p=0.77-0.84 and p=0.15-0.23 corresponding to Gaussian means of 27.5 s and 0.79 s respectively for long and bursts. Since the entire Dirichlet must sum to p=1, this leaves little room for a third sub-population. In fact, the next highest probability for an additional subpopulation is 0.001. Additionally, we checked that using Student-t distributions to model the sub-populations, i.e., seeing if non-normality or outliers changed the distributions. We found similar results with the Student-t distributions converging to Gaussians. We can therefore conclude that there exist only two sub-populations in the T90 distribution of GBM detected GRBs.

For a comparison with BATSE distribution of GRB durations, we have performed the same classification on the current BATSE catalog of 2041 GRBs consisting of 500 short and 1541 long GRBs^{10}. For GBM GRB sample, the best fitting model is two components with equal variances, while for BATSE sample it is the two component with unequal variances. To compare similar quantities, we forced the unequal variance model for GBM (which gives only a marginally worse fit) and compared it to the BATSE models. The mean T_{90} for the short bursts for BATSE vs. GBM are T^{BATSE}

mean,short = 0.85 s, T GBM mean,short = 0.82 s for the long, similarly BATSE vs. GBM T

BATSE mean,long = 35.6

s, T^{GBM}_{mean,long} = 28.3 s. The mean durations of the short and long GRBs are consistent with those estimated above by the Bayesian analysis. It may be noted that the mean durations of the GBM detected long GRBs is smaller than those of BATSE detected long GRBs. This could be an indication of the well known tip-of-the-iceberg effect resulting from the higher sensitivity of BATSE detectors which are 16 times larger than the GBM detectors.

The standard deviations of log_{10}(T_{90}/s) for short bursts in the GBM sample is 0.51 while for BATSE it is 0.64. The same quantity for long GRBs in the GBM sample is 0.64 while for BATSE it is 0.42. The larger difference between the widths of long and short GRBs of the BATSE sample explains the preference for the model with unequal variances. However the reason for unequal widths is not clear.

Since there are several changes and interruptions in GBM triggers and trigger algorithms during this catalog period (see table 4) it will not be strictly accurate to get the burst rate by dividing the number of bursts by the total duration of 6 years. Instead we derived the average GRB rates by fitting the integral interval distributions of the burst trigger times to an exponential distribution function. The estimated daily rate of short GRBs is (0.137 ± 0.009) while that of long GRBs is 0.602 ± 0.018. The fraction of short GRBs is 0.207 ± 0.015. Selecting periods where all three BATSE trigger algorithm were set to the same value (e.g. a threshold of 5.5σ from 1992 September 14 to 1994 September 19 and from 1996 August 29 to the end of the mission) the observed fraction

10http://gammaray.nsstc.nasa.gov/batse/grb/catalog/current/index.html

– 17 –

of short GRBs is 24% (Paciesas et al. 1999). The shortest and longest time intervals between consecutive short bursts are 1.34h and 59 days, respectively, while the average interval is 7.28 days. Similarly the shortest and longest time intervals between consecutive long bursts are 631s and 11.8 days (with no interruptions) while the average interval is 1.66 days. As already claimed in the first catalog we ascribe the lower fraction of short GRBs observed with GBM (20.7%) compared to BATSE (24%) not to a deficit of short events but rather to an excess of long events detected by GBM’s longer timescale trigger algorithms (see Section 2.3). The average GBM GRB trigger rate of ∼242 ± 6.5 bursts/year is comparable to the BATSE rate of 300 bursts/year, in spite of the large difference in area between the BATSE and GBM detectors. The BATSE detectors were a factor of 16 larger in area, as mentioned before, resulting in a difference of a factor of 4 in sensitivity. However, the logN-logP curve is much flatter near the BATSE threshold than the -3/2 power law seen at higher intensities. Also, the GBM trigger thresholds is set at 4.5 sigma above threshold, while for BATSE it was set at 5.5 sigma. The higher setting was needed to reject BATSE triggers due to fluctuations in the flux from Cygnus X-1. Although GBM employs 12 detectors compared to 8 for BATSE, the sky coverage is about the same due to obstructions by the LAT on Fermi, as opposed to clear views obtained on Compton Gamma-ray Observatory (CGRO). Most significantly, GBM triggers on 5 timescales from 16 ms to 4096 ms, at two different phases, whereas BATSE triggered only on 3 timescales 64, 256, and 1024 ms. Pre-launch predictions of the GBM burst rate were approximately 200 bursts/year based on scaling from BATSE, and assuming the same trigger algorithms. This is, within statistics, the observed rate of GBM triggers that would have triggered on one of the BATSE timescales. The additional ∼42 bursts/year arise mostly from the triggers on the new 4096 ms timescale.

Since the orbits of Fermi and GRO are similar, GBM and BATSE should have similar celestial sensitivity maps. However, sensitivity sky maps are not maintained for GBM since the isotropy of gamma-ray bursts is no longer controversial. Furthermore GBM slightly favors triggering on long GRBs, since the thresholds for the 64 ms timescales are higher (5.0σ, see Table 2) than for 256 & 1024 ms (both 4.5σ)^{11}.

To characterize the dependence of burst spectral hardness on duration, we computed the hardness of each GRB as the ratio of burst fluence during the T_{50} or T_{90} intervals in the energy band 50 – 300 keV to that in the 10 – 50 keV band. In this analysis, the hardness was derived from the time-resolved spectral fits for each GRB by using photon model fit parameters that are a by-product of the duration analysis. Figure 7 shows scatter plots of hardness vs. T_{50} and T_{90} durations, showing that the GBM data also exhibit the anti-correlation of spectral hardness with duration as known from BATSE data (Kouveliotou et al. 1993). However the individual data points are somewhat misleading, as the high hardness ratios tend to have large statistical errors, which are not plotted for the sake of clarity. Hence we also computed weighted mean hardness ratios for

11It may be noted that there were also times when BATSE triggers did not use the same threshold for all 3 timescales (see Table 1 in Paciesas et al. 1999). see http://heasarc.gsfc.nasa.gov/W3Browse/all/batsegrb.html

– 18 –

GRBs in equal bins of logarithmic durations^{12}. These are shown in green with their corresponding weighted errors. The green points indicate a gradual hardening of the GRBs as the durations fall below T_{90} = 2 s, which is in contrast to PHEBUS^{13} and BATSE observations, that showed a more discrete change in hardness at T_{90} = 2 s (Dezalay et al. 1992; Paciesas et al. 2003). However we do not see any positive correlation of hardness ratio with duration for long GRBs as reported before (Dezalay et al. 1996). Instead, we see a weak anti-correlation (correlation coefficient of -0.17) of hardness ratio with duration of long GRBs in our 6 year sample.

Integral distributions of the peak fluxes observed for GRBs in the first six years are shown in Figures 10 – 12 for the three different timescales and separately for short and long GRBs. In a Euclidean space, if all the long GRB progenitors are uniformly distributed, they would be expected to follow a -3/2 power-law. However, in a Big Bang cosmology, the effects of the (unknown) GRB luminosity function, along with their distribution in redshift (which follows more or less the star formation rate up to z∼4) and the threshold of the instrument are all convolved together to produce the observed distribution. The GRB peak flux distributions could however provide useful constraints in various astrophysical studies, such as in determining the true GRB rate for any jet model (Guetta, Granot and Begelman, 2005). The integral fluence distributions for the two energy intervals are also shown in Figure 13. It may be noted that the integral fluence distributions show far more curvature than the integral peak flux distributions. Although the deficit at the highest fluence end may be due to small number statistics, the observed departure from the expected power-law of slope -3/2 at low fluence may be due to the fact that these GRB fluence estimates suffer from relatively large systematic errors, primarily due to limited spectral channels and rather narrow time bins with very few events that are used for spectral fitting. Moreover, GRB triggers on GRB peak flux and not on fluence, so that there is no clear well defined GBM fluence threshold.

6. SUMMARY

The third GBM catalog comprises a list of 1403 cosmic GRBs that triggered GBM between July 12, 2008 and July 11, 2014. The increased sample of GRB in this catalog confirms the conclusions of the earlier two year and four year catalogs. The 6 year average GRB rate detected by GBM is (0.662 ± 0.018) per day. The shortest and longest time interval between consecutive GRB triggers is 10 minutes and 11.77 days (with no interruptions) respectively. The shortest time interval is close to the minimum time for GBM to re-trigger. The longest time interval is ∼ 8 times larger than the average value of 1.5 days. Assuming that the GRB triggers follow Poisson statistics, this implies that such a large time gap could occur once in ∼ 10 years. The average rate of burst detections per year (∼ 242 ± 6.5/year), which is only slightly smaller compared to the detection rate of the BATSE instrument of ∼ 300/year (Paciesas et al. 1999). One would have expected a

12Note that these are NOT the same as weighted means of log(HR)

13PHEBUS was a Soviet-French gamma-ray burst experiment onboard GRANAT satellite launched before CGRO.

– 19 –

larger difference due to the superior detection sensitivity of BATSE. This perhaps can be explained by GBM’s additional range of trigger timescales (primarily the 2 s and 4 s timescales), which are compensating for the higher burst detection threshold of GBM (∼ 0.7 vs. ∼ 0.2 photons cm^{−2} s^{−1} for BATSE). The distribution of GBM durations is consistent with the well-known bimodal distribution measured previously (Kouveliotou et al. 1993). This is supported by two independent analyses. Assuming a T_{90} value of 2 s to distinguish between short and long GRBs, the median durations of the two groups are 0.58 s and 26.62 s for the GBM sample while they are 0.45 s and 30.75 s respectively for the BATSE sample. The median duration of GBM detected long bursts is lower than that of BATSE detected long GRBs. However the fraction of short GRBs in the GBM sample is about 21% which is not significantly different from that detected by BATSE which is 24%.

Support for the German contribution to GBM was provided by the Bundesministerium für Bildung und Forschung (BMBF) via the Deutsches Zentrum für Luft und Raumfahrt (DLR) under contract number 50 QV 0301. A.v.K. was supported by the Bundesministeriums für Wirtschaft und Technologie (BMWi) through DLR grant 50 OG 1101. SMB and OJR acknowledge support from Science Foundation Ireland under Grant No. 12/IP/1288. HFY acknowledges support by the DFG cluster of excellence “Origin and Structure of the Universe”. A.G. is funded by the NASA Postdoctoral Program through Oak Ridge Associated Universities. The UAH co-authors gratefully acknowledge NASA funding from co-operative agreement NNM11AA01A. CK and CAWH gratefully acknowledge NASA funding through the Fermi GBM project.

REFERENCES

Aasi, J.; Abbott, B. P.; Abbott, R., 2014, Phys. Rev. D, 8912004

Ackermann, M., Ajello, M., Asano, K., et al. 2013, ApJS, 209, 11

Barthelmy, S. D., Barbier, L. M., Cummings, J. R., et al. 2005, Space Sci. Rev., 120, 143

Barthelmy, S. D., Gehrels, N., & Paciesas, W. 2009, GCN Circ., 10251, 1

Band, D. L. 2002, ApJ, 578, 806

Band, D., Briggs, M., Connaughton, V., Kippen, M., & Preece, R. 2004, in AIP Conf. Proc. 727, Gamma-Ray Bursts: 30 Years of Discovery, ed. E. Fenimore & M. Galassi (Melville, NY: AIP), 688

Basano, A. Bird, A. J. Laurent, P., 2003, Nucl. Inst. & Meth. A, 513, 118

Bissaldi, E., von Kienlin, A., Kouveliotou, C., et al. 2011, ApJ, 733, 97

– 20 –

Briggs, M. S., Xiong, S., Connaughton, V., et al. 2013, Journal of Geophysical Research (Space Physics), 118, 3805 Chattopadhyay, T., Misra, R., Chattopadhyay, A. K. & Naskar, M., 2007, ApJ, 667, 1017. Connaughton, V., Briggs, M. S., Goldstein, A., et al. 2015, ApJS, 216, 32 Dezalay, J. -P., Barat, C., Talon, R., et al., 1992, in AIP Conf. Proc. 265, Gamma-ray bursts; Proceedings of the Workshop, Univ. of Alabama, Huntsville, ed. W. S. Paciesas & G. J. Fishman, 304 Dezalay, J. -P., Lestrade, J. P., Barat, C., et al., 1996, ApJ, 471, 27 Evans, P. A.; Willingale, R.; Osborne, J. P., et al., 2014, MNRAS, 444, 250 Fraley, C., & Raftery, A. E. 2000, J. Am. Stat. Assoc., 97, 611 Fishman, G. J., Briggs, M. S., Connaughton, V., et al. 2011, J. of Geophys. Res. (Space Physics), 116, 7304 Fishman G. J., et al. 1989, Proc. GRO Science Workshop, ed. W. N. Johnson (Greenbelt:NASA/GSFC), 2-39 (1989).

Gershman, S. J., & Blei, D. M. 2012, J. of Math. Psychology, 56, 1 Greiner, J., Yu, H.-F., Krühler, T., et al. 2014, A&A, 568, A75 Gruber, D., Krühler, T., Foley, S., et al. 2011, A&A, 528, A15 Gruber, D., Goldstein, A., Weller von Ahlefeld, V., et al., 2014, ApJS, 211, 12 Guetta, D., Granot, J. and Begelman, M. C., 2005, ApJ, 622, 482 Hoover, A. S.; Kippen, R. M.; Meegan, C. A et al. 2005, Nuovo Cimento C, 28, 797 Horváth, I., Balzás , L. G., Bagoly, Z., Ryde, F. and Mészáros, A. 2006, A&A, 447, 23 Hurley, K., Pal’shin, V. D., Aptekar, R. L., et al. 2013, ApJS, 207, 39 Klebesadel, R. W., Strong, I. B. and Olson, R. A. 1973, ApJ, 182, L85 Koshut, T. M., Paciesas, W. S., Kouveliotou, C. et al., . 1996, ApJ, 463, 570 Kouveliotou, C., Meegan, C. A., Fishman, G. J., et al. 1993, ApJ, 413, L101 Lin, L., Kouveliotou, C., Baring, M. G., et al. 2011, ApJ, 739, 87 Matichard, F., Lantz, B., Mittleman, R., et al., 2015, Classical and Quantum Gravity, 32, 185003 Meegan, C. A., Fishman, G. J., Wilson, R. B., et al. 1992, Nature, 355, 143

– 21 –

Meegan, C. A., Paciesas, W. S., Pendleton, G. N., et al. 1998, Gamma-Ray Bursts, 4th Hunstville Symposium, 428, 3 Meegan, C., Lichti, G., Bhat, P. N., et al. 2009, ApJ, 702, 791 Mukherjee, S. Feigelson, E. D. Jogesh B., et al. 1998, ApJ, 508, 314 Paciesas, W. S., Briggs, M. S. Preece, R. D., 1998, in AIP Conf. Proc. 662, GAMMA-RAY BURST AND AFTERGLOW ASTRONOMY 2001: A Workshop Celebrating the First Year of the HETE Mission, ed. G. R. Ricker & R. K. Vanderspek, 248 Paciesas, W. S., Meegan, C. A., Pendleton, G. N., et al. 1999, ApJS, 122, 465 Paciesas, W. S., Meegan, C. A., von Kienlin, A., et al. 2012, ApJS, 199, 18 Qin, Ying; Liang, En-Wei; Liang, Yun-Feng, et al., 2013, ApJ, 763, 15 R̆ipa, J. Mészáros, A. Veres, P. Park, I. H., 2012, ApJ, 756, 44 van der Horst, A. J., Connaughton, V., Kouveliotou, C., et al. 2010, ApJ, 711, L1 van der Horst, A. J., Kouveliotou, C., Gorgone, N. M., et al. 2012, ApJ, 749, 122 Veres, P. Bagoly, Z.; Horváth, I. Mészáros, A. Balázs, L. G., 2010, ApJ, 725, 1955 von Kienlin, A., Gruber, D., Kouveliotou, C., et al. 2012, ApJ, 755, 150 von Kienlin, A., Meegan, C. A., Paciesas, W. S., et al. 2014, ApJS, 211, 13 Yu, H. -F., R.D. Preece, J. Greiner, et al. 2015, A&A, accepted.

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 22 –

Fig. 1.— The quarterly trigger statistics over the first six years of the GBM mission. The total number of triggers in the time period from July 12, 2008 to July 11, 2014 are shown. The first quarter starts at July 12, 2008 (I-01) and ends at October 11, 2008 and so on until July 11, 2014. The different types of events triggering GBM are classified as shown at the top. The ’Other’ category includes accidental triggers and those that are too weak to locate or unambiguous in nature, as well as transient burst activity from galactic sources such as Cyg X-1 and V404 Cyg.

– 23 –

Fig. 2.— CTIME lightcurve of GRB 131229A (bn131229277) with 0.256 s temporal resolution in NaI(Tl) detector 10. Vertical dotted lines indicate the regions selected for fitting the background before and after the burst. The hatching defines the source region selected for the duration analysis. Note that the hatched region has good overlap with the background region before as well as after the burst.

– 24 –

Fig. 3.— The duration plot for GRB 131229A (bn131229277) is an example of the analysis for a GRB showing multiple pulses of different widths and amplitudes, some well separated and some overlapping. Data from NaI(Tl) detectors 9, 10 & 11 were used. Horizontal dotted lines are drawn at 5%, 25%, 75% and 95% of the total fluence. Vertical dashed lines are drawn at the times corresponding to those same fluences, thereby defining the T_{50} and T_{90} intervals.

– 25 –

Fig. 4.— Sky distribution of GBM triggered GRBs in celestial coordinates. Crosses indicate long GRBs (T_{90} > 2 s); asterisks indicate short GRBs. Also shown are the GBM GRBs simultaneously detected by Swift (red squares)

– 26 –

Fig. 5.— Distribution of GRB durations in the 50–300 keV energy range. The upper plot shows T_{50} and the lower plot shows T_{90}. Also shown are the lognormal fits separately to long and short GRBs (see text for details).

– 27 –

Fig. 6.— Figure showing the BIC values to establish the number of components that best describe the GRB duration distributions. In the unequal variance model all parameters are left to vary, while in the equal variance case, the variances of the components are restricted to be equal among the components. The upper plot corresponds to T_{50} and the lower plot corresponds to T_{90} distributions. The peak at the number of components = 2 shows that the observed GRB duration distribution is best described by a 2 component model as shown in figure 5.

– 28 –

Fig. 7.— Logarithmic scatter plots of spectral hardness vs. duration are shown for the two duration measures T_{50} (upper plot) and T_{90} (lower plot). The spectral hardness was computed from the duration analysis results by summing the deconvolved counts in each detector and time bin in two energy bands (10 – 50 keV and 50 – 300 keV), and further summing each quantity in time over the T_{50} and T_{90} intervals. The hardness ratio was calculated separately for each detector as the ratio of the flux density and finally averaged over detectors. The error bars for individual bursts are suppressed for clarity. 1376 T_{90} hardness ratios and 1364 T_{50} hardness ratios out of a total sample of 1403 GRBs have been estimated and plotted here. The rest are too weak to compute hardness ratios and hence ignored. The short and long GRBs were further divided in to equal logarithmic duration sub-groups. The green points with errors are the average values of hardness ratios weighted with inverse of their errors over GRBs that fall under each group. The anti-correlation of spectral hardness with burst duration is evident.

– 29 –

Fig. 8.— Classification based on the hardness-duration diagram. Here we show only GRBs with hardness errors less than the hardness itself. Colors indicate their group membership (red: on average short/hard, blue: on average long/soft). Ellipses show the best fitting multivariate gaussian models. In the T90-HR case (bottom) the best model has components with equal volume and shape (the major and minor axes of the ellipses are equal) but their orientation is not constrained. For T50-HR (top) the best model has similar properties as for T90-HR, only the orientation of the components is constrained to be the same (see Figure 9 for BIC values of different models).

– 30 –

Fig. 9.— BIC values for the hardness-duration data [T90-HR (bottom) and T50-HR (top)] for the relevant bi-variate normal component models. For clarity, we only show the best faring models. See Figure 8 for the realization of the best models.

– 31 –

Fig. 10.— Integral distribution of GRB peak flux on the 1.024 s timescale. Energy ranges are 10 – 1000 keV (upper plot) and 50 – 300 keV (lower plot). Distributions are shown for the total sample (solid histogram), short GRBs (dots) and long GRBs (dash-dots), using T_{90} = 2 s as the distinguishing criterion. In each plot a power law with a slope of −3/2 (dashed line) is drawn to guide the eye.

– 32 –

Fig. 11.— Same as Figure 10, except on the 0.256 s timescale.

– 33 –

Fig. 12.— Same as Figure 10, except on the 0.064 s timescale.

– 34 –

Fig. 13.— Integral distribution of GRB fluence (S ergs/cm^2) in two energy ranges: 10–1000 keV (upper plot) and 50–300 keV (lower plot). Distributions are shown for the total sample (solid histogram), short GRBs (dots) and long GRBs (dash-dots), using T_{90} = 2 s as the distinguishing criterion. In each plot a power law with a slope of −3/2 (dashed line) is drawn to guide the eye.

– 35 –

Table 1: Trigger statistics of the year 1 & 2 and year 3 & 4 catalogs GRBs SGRs TGFs SFs CPs Other Sum ARRs LAT GRBs Year 1 & 2 492^a 171 79 31 68^b 65^b 906^c 40 22 Year 3 & 4 462 18 183 363 141 53 1220 46 21^d Year 5 & 6 451^a 9 207 400 96 61 1224 33 29^d Year 1 to 6 1405 198 469 794 305 179 3350 119^e 72

aGRB 091024A and GRB130925A each of which triggered GBM twice, are counted twice. Hence the total number of GRB’s is one less in each group.

bThe numbers of non GRB triggers in year 1 & 2 differ from the numbers cited in Paciesas et al. (2012), since some of the triggers were reclassified cThe total numbers of triggers is two less compared to Paciesas et al. (2012), since the two commanded triggers (bn100709294 & bn100711145) were not counted.

dThe three year Fermi LAT GRB catalog (Ackermann et al. 2013) includes bursts only from August 2008 to August 2011 (Year 1 & 2: 22 GRBs, Year 3 & 4: 13 GRBs). The 29 additional GRB detections from year 5 & 6, are listed in the public GRB list of the Fermi LAT team: http://fermi.gsfc.nasa.gov/ssc/observations/types/grbs/lat_grbs/ eDue to misclassification of events as GRBs by the FSW, 26 of the ARRs occurred for other event types. Of these 16 occurred due to charged particle events, 5 occurred due to SGR events, 4 occurred due to solar flare events and 1 due to a TGF event. In addition, there were a few positive ARRs from GBM triggers followed by no spacecraft slews, which was disabled at the spacecraft level at that time. In a few cases the spacecraft slew started well after the GBM trigger due to Earth’s limb constraint.

– 36 –

Table 2. Trigger Criteria History

Algorithm Timescale Offset Channels Energy Threshold (0.1σ)^a

2008 2009 2010 Number (ms) (ms) (keV) July 11 July 14 Aug 1 May 8 Oct 29 Nov 10 Dec 7 Mar 26

1 16 0 3–4 50–300 75 24 24 24 24 24 24 24 2 32 0 3–4 50–300 75 24 24 24 24 24 24 24 3 32 16 3–4 50–300 75 24 24 24 24 24 24 24 4 64 0 3–4 50–300 45 24 50 24 24 24 24 24 5 64 32 3–4 50–300 45 24 50 24 24 24 24 24 6 128 0 3–4 50–300 45 24 48 50 24 24 24 24 7 128 64 3–4 50–300 45 24 48 50 24 24 24 24 8 256 0 3–4 50–300 45 24 24 24 24 24 24 24 9 256 128 3–4 50–300 45 24 24 24 24 24 24 24 10 512 0 3–4 50–300 45 24 24 24 24 24 24 24 11 512 256 3–4 50–300 45 24 24 24 24 24 24 24 12 1024 0 3–4 50–300 45 24 24 24 24 24 24 24 13 1024 512 3–4 50–300 45 24 24 24 24 24 24 24 14 2048 0 3–4 50–300 45 24 24 24 24 24 24 24 15 2048 1024 3–4 50–300 45 24 24 24 24 24 24 24 16 4096 0 3–4 50–300 45 24 24 24 24 24 24 24 17 4096 2048 3–4 50–300 45 24 24 24 24 24 24 24 18 8192 0 3–4 50–300 C 50 24 24 D 24 24 24 19 8192 4096 3–4 50–300 C 50 24 24 D 24 24 24 20 16384 0 3–4 50–300 C 50 D 24 24 24 24 24 21 16384 8192 3–4 50–300 C 50 D 24 24 24 24 24 22 16 0 2–2 25–50 D 80 24 24 24 24 24 24 23 32 0 2–2 25–50 D 80 24 24 24 24 24 24 24 32 16 2–2 25–50 D 80 24 24 24 24 24 24 25 64 0 2–2 25–50 D 55 24 24 24 24 24 24 26 64 32 2–2 25–50 D 55 24 24 24 24 24 24

– 37 –

Table 2—Continued

Algorithm Timescale Offset Channels Energy Threshold (0.1σ)^a

2008 2009 2010 Number (ms) (ms) (keV) July 11 July 14 Aug 1 May 8 Oct 29 Nov 10 Dec 7 Mar 26

27 128 0 2–2 25–50 D 55 24 24 D 24 24 24 28 128 64 2–2 25–50 D 55 24 24 D 24 24 24 29 256 0 2–2 25–50 D 55 24 24 D 24 24 24 30 256 128 2–2 25–50 D 55 24 24 D 24 24 24 31 512 0 2–2 25–50 D 55 24 24 D 24 24 24 32 512 256 2–2 25–50 D 55 24 24 D 24 24 24 33 1024 0 2–2 25–50 D 55 24 24 D 24 24 24 34 1024 512 2–2 25–50 D 55 24 24 D 24 24 24 35 2048 0 2–2 25–50 D 55 24 24 D 24 24 24 36 2048 1024 2–2 25–50 D 55 24 24 D 24 24 24 37 4096 0 2–2 25–50 D 65 24 24 D 24 24 24 38 4096 2048 2–2 25–50 D 65 24 24 D 24 24 24 39 8192 0 2–2 25–50 D 65 24 24 D 24 24 24 40 8192 4096 2–2 25–50 D 65 24 24 D 24 24 24 41 16384 0 2–2 25–50 D 65 D 24 24 24 24 24 42 16384 8192 2–2 25–50 D 65 D 24 24 24 24 24 43 16 0 5–7 > 300 D 80 24 24 24 24 24 24 44 32 0 5–7 > 300 D 80 24 24 D 24 24 24 45 32 16 5–7 > 300 D 80 24 24 D 24 24 24 46 64 0 5–7 > 300 D 55 24 60 D 24 24 24 47 64 32 5–7 > 300 D 55 24 60 D 24 24 24 48 128 0 5–7 > 300 D 55 24 24 D 24 24 24 49 128 64 5–7 > 300 D 55 24 24 D 24 24 24 50 16 0 4–7 > 100 D 80 24 24 24 24 24 24 51 32 0 4–7 > 100 D 80 24 24 D 24 24 24 52 32 16 4–7 > 100 D 80 24 24 D 24 24 24

– 38 –

Table 2—Continued

Algorithm Timescale Offset Channels Energy Threshold (0.1σ)^a

2008 2009 2010 Number (ms) (ms) (keV) July 11 July 14 Aug 1 May 8 Oct 29 Nov 10 Dec 7 Mar 26

53 64 0 4–7 > 100 D 55 24 24 D 24 24 24 54 64 32 4–7 > 100 D 55 24 24 D 24 24 24 55 128 0 4–7 > 100 D 55 24 24 D 24 24 24 56 128 64 4–7 > 100 D 55 24 24 D 24 24 24 57 256 0 4–7 > 100 D 55 24 24 D 24 24 24 58 256 128 4–7 > 100 D 55 24 24 D 24 24 24 59 512 0 4–7 > 100 D 55 24 24 D 24 24 24 60 512 256 4–7 > 100 D 55 24 24 D 24 24 24 61 1024 0 4–7 > 100 D 55 24 24 D 24 24 24 62 1024 512 4–7 > 100 D 55 24 24 D 24 24 24 63 2048 0 4–7 > 100 D 55 24 24 D 24 24 24 64 2048 1024 4–7 > 100 D 55 24 24 D 24 24 24 65 4096 0 4–7 > 100 D 65 24 24 D 24 24 24 66 4096 2048 4–7 > 100 D 65 24 24 D 24 24 24 5–7 > 300 60 55 :

116^b 16 0 BGO/3–6 2 - 40 MeV

D : : : : 55 45 :

5–7 > 300 55 45 : 117^b 16 0 BGO/3–6 2 - 40 MeV

D : : : : 55 45 :

5–7 > 300 55 45 : 118^b 16 0 BGO/3–6 2 - 40 MeV

D : : : : 55 45 :

119^b 16 0 BGO/3–6 2 - 40 MeV D : : : : 55 45 47

aSymbol ’:’ indicates no change from previous setting; ’C’ indicates that the algorithm is in compute mode (see text); ’D’ indicates that the algorithm is disabled.

– 39 – bTrigger algorithms using the BGO detector count rates. Algorithm 116 triggers off when at least two NaI and one BGO detectors are exceeding the trigger threshold. Algorithms 117 is same as 116, but impose the additional requirement that the triggered detectors are on the +X side of the spacecraft. Algorithm 118 is the same as 117, but requiring the triggered detectors to be on the -X side of the spacecraft. Algorithm 119 requires a significant rate increase in both BGO detectors.

– 40 –

Table 3: Trigger algorithm statistics Algorithm Time ms Energy keV GRBs SGRs TGFs SFs CPs Other Comment^a 1 - 5 16 -64 50 - 300 235 73 8 6 9 17 GRB 6 - 11 128 - 512 50 - 300 509 8 - 41 12 37 GRB 12 - 17 1024 - 4096 50 - 300 639 1 - 167 230 30 GRB 18 - 21 8192 - 16384 50 - 300 3 - - - - - D 22 - 26 16 -64 25 - 50 7 113 - 577 11 7 SF 27 - 32 128 - 512 25 - 50 2 3 - 1 2 - D 33 - 38 1024 - 4096 25 - 50 8 - - 2 11 3 D 39 - 42 8192 - 16384 25 - 50 1 - - - 8 3 D 43 16 > 300 - - 43 - 1 1 TGF 44 - 49 32 - 128 > 300 - - - - - 5 D 50 16 > 100 - - 9 - 4 - TGF 51 - 66 32 - 4096 > 100 1 - - - - - D 116 - 119 16 BGO - - 409 - 16 76 TGF

a’GRB’, ’SF’ and ’TGF’ indicate the source classes that are most likely to trigger the corresponding algorithm; ’D’ indicates that the algorithm was finally disabled at the end of year 4.

– 41 –

Table 4. Trigger Modification History

Date Year/DOY/UT Operation

7/1/12 2012/183:22:14:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/183:22:14:32 Disable triggers 2012/184:01:39:24 Enable triggers 7/2/12 2012/184:01:39:44 Restore LLT thresholds to 24 for dets. NaI0 - 5 7/11/12 2012/193:18:11:31 LLTs set to 59 for dets. NaI0-5 8/3/12 2012/216:18:57:10 Disable soft trigger algs. 22-26 2012/216:18:57:15 McIlwain = 1.58 8/6/12 2012/219:13:30:05 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/219:13:30:10 Re-enable soft trigger algs. 22-26 8/7/12 2012/220:16:01:37 LLTs set to 59 for dets. NaI0-5 8/11/12 2012/223:01:40:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/223:01:40:32 Disable triggers 2012/223:05:04:00 Enable triggers 2012/223:05:04:20 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/223:16:22:00 LLTs set to 59 for dets. NaI0-5 2012/223:16:22:05 Disable soft trigger algs. 22-26 8/12/12 2012/225:23:44:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/225:23:44:32 Disable triggers 8/13/12 2012/226:03:08:05 Enable triggers

2012/226:03:08:25 LLTs set to 59 for dets. NaI0-5 2012/226:14:17:00 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/226:14:17:05 Re-enable soft trigger algs. 22-26 8/14/12 2012/227:23:30:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/227:23:30:32 Disable triggers 8/15/12 2012/228:02:54:00 Enable triggers

2012/228:02:54:10 Restore LLT thresholds to 24 for dets. NaI0 - 5 8/17/12 2012/230:21:34:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/230:21:34:32 Disable triggers 8/18/12 2012/231:00:57:50 LLTs set to 59 for dets. NaI0-5 2012/231:00:57:55 Disable soft trigger algs. 22-26 2012/231:00:58:25 Enable triggers 8/22/12 2012/235:19:22:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/235:19:22:32 Disable triggers 2012/235:22:45:50 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/235:22:45:52 Re-enable soft trigger algs. 22-26 2012/235:22:46:15 Enable triggers 8/24/12 2012/237:19:56:35 LLTs set to 59 for dets. NaI0-5 2012/237:19:56:40 Disable soft trigger algs. 22-26

– 42 –

Table 4—Continued

Date Year/DOY/UT Operation

8/27/12 2012/240:17:08:01 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/240:17:08:13 Disable triggers 2012/240:20:41:05 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/240:20:41:10 Re-enable soft trigger algs. 22-26 2012/240:20:41:35 Enable triggers 8/31/12 2012/244:20:34:50 LLTs set to 59 for dets. NaI0-5 2012/244:20:34:55 Disable soft trigger algs. 22-26 9/4/12 2012/248:15:06:50 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/248:15:06:55 Re-enable soft trigger algs. 22-26 9/7/12 2012/251:19:41:40 LLTs set to 59 for dets. NaI0-5 2012/251:19:41:45 Disable soft trigger algs. 22-26 9/10/12 2012/254:15:53:40 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/254:15:53:45 Re-enable soft trigger algs. 22-26 9/14/12 2012/258:22:09:48 LLTs set to 59 for dets. NaI0-5 2012/258:22:09:53 Disable soft trigger algs. 22-26 9/17/12 2012/261:16:42:48 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/261:16:42:53 Re-enable soft trigger algs. 22-26 9/21/12 2012/265:17:51:05 LLTs set to 59 for dets. NaI0-5 2012/265:17:51:10 Disable soft trigger algs. 22-26 9/24/12 2012/268:15:47:26 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/268:15:47:31 Re-enable soft trigger algs. 22-26 9/28/12 2012/272:15:16:05 LLTs set to 59 for dets. NaI0-5 2012/272:15:16:10 Disable soft trigger algs. 22-26 10/1/12 2012/275:22:33:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/275:22:33:32 Disable triggers 10/2/12 2012/276:01:57:20 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/276:01:57:25 Re-enable soft trigger algs. 22-26 2012/276:01:58:20 Enable triggers 10/5/12 2012/279:20:29:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/279:20:29:32 Disable triggers 2012/279:23:52:43 LLTs set to 59 for dets. NaI0-5 2012/279:23:52:48 Disable soft trigger algs. 22-26 2012/279:23:53:50 Enable triggers 10/9/12 2012/283:18:22:20 Elevate LLT thresholds to 101 for dets. NaI0 - 5 2012/283:18:22:32 Disable triggers 2012/283:21:49:10 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/283:21:49:15 Re-enable soft trigger algs. 22-26 2012/283:21:49:50 Enable triggers

– 43 –

Table 4—Continued

Date Year/DOY/UT Operation

10/12/12 2012/286:20:26:05 LLTs set to 59 for dets. NaI0-5 2012/286:20:26:10 Disable soft trigger algs. 22-26 10/15/12 2012/289:16:45:05 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/289:16:45:10 Re-enable soft trigger algs. 22-26 2012/293:19:25:50 LLTs set to 59 for dets. NaI0-5 2012/293:19:25:55 Disable soft trigger algs. 22-26 10/19/12 2012/296:15:42:50 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/296:15:42:55 Re-enable soft trigger algs. 22-26 2012/296:17:09:45 LLTs set to 59 for dets. NaI0-5 2012/296:17:12:06 Disable soft trigger algs. 22-26 10/26/12 2012/300:20:13:45 LLTs set to 59 for dets. NaI0-5 2012/300:20:13:50 Disable soft trigger algs. 22-26 10/29/12 2012/303:14:43:45 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/303:14:43:50 Re-enable soft trigger algs. 22-26 11/2/12 2012/307:19:17:45 LLTs set to 59 for dets. NaI0-5 2012/307:19:17:50 Disable soft trigger algs. 22-26 11/5/12 2012/310:15:31:45 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/310:15:31:50 Re-enable soft trigger algs. 22-26 11/9/12 2012/314:16:40:45 LLTs set to 59 for dets. NaI0-5 2012/314:16:40:50 Disable soft trigger algs. 22-26 2012/318:14:27:12 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/318:14:27:17 Re-enable soft trigger algs. 22-26 2012/318:22:58:30 LLTs set to 59 for dets. NaI0-5 2012/318:23:00:49 Disable soft trigger algs. 22-26 11/16/12 2012/321:14:03:13 LLTs set to 59 for dets. NaI0-5 2012/321:14:03:18 Disable soft trigger algs. 22-26 11/19/12 2012/324:22:27:42 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/324:22:27:47 Re-enable soft trigger algs. 22-26 11/22/12 2012/327:01:24:05 LLTs set to 59 for dets. NaI0-5 2012/327:01:24:10 Disable soft trigger algs. 22-26 11/26/12 2012/331:14:01:20 upload startup table for fsw 2.7 2012/331:15:21:57 boot fsw 2.7 2012/331:19:47:45 Restore LLT thresholds to 24 for dets. NaI0 - 5 2012/331:19:47:50 Re-enable soft trigger algs. 22-26 1/18/13 2013/018:21:07:40 Disable soft trigger algs. 22-26 1/21/13 2013/021:14:08:40 Re-enable soft trigger algs. 22-26 1/25/13 2013/025:21:54:40 Disable soft trigger algs. 22-26 1/28/13 2013/028:16:23:40 Re-enable soft trigger algs. 22-26

– 44 –

Table 4—Continued

Date Year/DOY/UT Operation

2/1/13 2013/032:20:56:40 Disable soft trigger algs. 22-26 2/4/13 2013/035:13:45:40 Re-enable soft trigger algs. 22-26 2/8/13 2013/039:18:17:40 Disable soft trigger algs. 22-26 2/11/13 2013/042:16:11:40 Re-enable soft trigger algs. 22-26 2/15/13 2013/046:13:57:40 Disable soft trigger algs. 22-26 2/19/13 2013/050:11:43:40 Re-enable soft trigger algs. 22-26 2/22/13 2013/053:21:47:40 Disable soft trigger algs. 22-26 2/25/13 2013/056:19:42:40 Re-enable soft trigger algs. 22-26 3/1/13 2013/060:20:43:40 Disable soft trigger algs. 22-26 3/4/13 2013/063:17:01:40 Re-enable soft trigger algs. 22-26 3/8/13 2013/067:21:24:40 Disable soft trigger algs. 22-26 3/11/13 2013/070:15:57:40 Re-enable soft trigger algs. 22-26 3/15/13 2013/074:20:27:40 Disable soft trigger algs. 22-26 3/18/13 2013/077:14:56:40 Re-enable soft trigger algs. 22-26 3/22/13 2013/081:19:29:40 Disable soft trigger algs. 22-26 3/25/13 2013/084:14:00:40 Re-enable soft trigger algs. 22-26 3/29/13 2013/088:16:50:40 Disable soft trigger algs. 22-26 4/1/13 2013/091:14:43:40 Re-enable soft trigger algs. 22-26 4/5/13 2013/095:12:28:40 Disable soft trigger algs. 22-26 4/8/13 2013/098:12:03:40 Re-enable soft trigger algs. 22-26 4/12/13 2013/102:20:17:40 Disable soft trigger algs. 22-26 4/15/13 2013/105:18:14:44 Re-enable soft trigger algs. 22-26 4/19/13 2013/109:20:51:40 Disable soft trigger algs. 22-26 4/22/13 2013/112:15:30:40 Re-enable soft trigger algs. 22-26 4/26/13 2013/116:19:51:40 Disable soft trigger algs. 22-26 4/29/13 2013/119:14:25:40 Re-enable soft trigger algs. 22-26 5/3/13 2013/123:20:36:40 Disable soft trigger algs. 22-26 5/6/13 2013/126:15:05:40 Re-enable soft trigger algs. 22-26 5/10/13 2013/130:19:37:40 Disable soft trigger algs. 22-26 5/13/13 2013/133:14:08:40 Re-enable soft trigger algs. 22-26 5/13/13 2013/133:20:40:40 Disable soft trigger algs. 22-26 5/17/13 2013/137:15:15:40 Disable soft trigger algs. 22-26 5/20/13 2013/140:13:08:40 Re-enable soft trigger algs. 22-26 5/24/13 2013/144:23:02:40 Disable soft trigger algs. 22-26 5/27/13 2013/147:20:57:40 Re-enable soft trigger algs. 22-26 5/31/13 2013/151:20:18:40 Disable soft trigger algs. 22-26 6/3/13 2013/154:18:13:40 Re-enable soft trigger algs. 22-26 6/7/13 2013/158:20:54:40 Disable soft trigger algs. 22-26

– 45 –

Table 4—Continued

Date Year/DOY/UT Operation

6/10/13 2013/161:13:53:40 Re-enable soft trigger algs. 22-26 6/14/13 2013/165:19:56:40 Disable soft trigger algs. 22-26 6/17/13 2013/168:14:25:40 Re-enable soft trigger algs. 22-26 6/28/13 2013/179:17:57:40 Disable soft trigger algs. 22-26 7/1/13 2013/182:14:08:40 Re-enable soft trigger algs. 22-26 7/5/13 2013/186:13:34:40 Disable soft trigger algs. 22-26 7/8/13 2013/189:13:09:40 Re-enable soft trigger algs. 22-26 7/12/13 2013/193:10:53:00 Disable soft trigger algs. 22-26 2013/196:19:17:00 Re-enable soft trigger algs. 22-26 7/19/13 2013/200:20:15:40 Disable soft trigger algs. 22-26 7/22/13 2013/203:16:32:00 Re-enable soft trigger algs. 22-26 7/26/13 2013/207:20:53:40 Disable soft trigger algs. 22-26 7/29/13 2013/210:13:48:40 Re-enable soft trigger algs. 22-26 8/2/13 2013/214:19:54:40 Disable soft trigger algs. 22-26 8/5/13 2013/217:14:22:40 Re-enable soft trigger algs. 22-26 8/9/13 2013/221:18:52:00 Disable soft trigger algs. 22-26 2013/223:04:41:00 Disable triggers 2013/223:07:14:20 Enable triggers 2013/224:04:32:00 Disable triggers 2013/224:07:05:20 Enable triggers 8/12/13 2013/224:15:04:40 Re-enable soft trigger algs. 22-26 2013/225:04:23:00 Disable triggers 2013/225:06:57:20 Enable triggers 8/16/13 2013/228:02:16:00 Disable triggers 2013/228:04:50:20 Enable triggers 8/16/13 2013/228:16:11:40 Disable soft trigger algs. 22-26 8/19/13 2013/231:14:03:40 Re-enable soft trigger algs. 22-26 2013/233:22:58:00 Disable triggers 8/23/13 2013/235:13:31:00 Disable soft trigger algs. 22-26 8/26/13 2013/238:11:22:00 Re-enable soft trigger algs. 22-26 8/26/13 2013/238:18:46:19 Enable triggers 8/30/13 2013/242:09:06:35 Disable soft trigger algs. 22-26 9/3/13 2013/246:17:22:35 Re-enable soft trigger algs. 22-26 9/6/13 2013/249:20:06:40 Disable soft trigger algs. 22-26 9/9/13 2013/252:14:45:40 Re-enable soft trigger algs. 22-26 9/13/13 2013/256:20:47:40 Disable soft trigger algs. 22-26 9/16/13 2013/259:13:38:40 Re-enable soft trigger algs. 22-26 9/20/13 2013/263:19:46:40 Disable soft trigger algs. 22-26

– 46 –

Table 4—Continued

Date Year/DOY/UT Operation

9/23/13 2013/266:12:33:40 Re-enable soft trigger algs. 22-26 2013/270:04:50:00 Disable triggers 2013/270:07:23:20 Enable triggers 9/27/13 2013/270:18:45:40 Disable soft trigger algs. 22-26 9/30/13 2013/273:13:15:40 Re-enable soft trigger algs. 22-26 10/1/13 2013/274:02:34:00 Disable triggers 2013/274:05:07:20 Enable triggers 10/2/13 2013/275:02:25:00 Disable triggers 2013/275:04:58:20 Enable triggers 10/3/13 2013/276:02:16:00 Disable triggers 2013/276:04:24:20 Enable triggers 10/4/13 2013/277:14:21:40 Disable soft trigger algs. 22-26 10/6/13 2013/279:00:09:00 Disable triggers 2013/279:02:18:20 Enable triggers 10/7/13 2013/280:00:00:00 Disable triggers 2013/280:02:08:20 Enable triggers 10/7/13 2013/280:13:55:40 Re-enable soft trigger algs. 22-26 10/11/13 2013/284:22:08:35 Disable soft trigger algs. 22-26 10/15/13 2013/288:19:52:35 Re-enable soft trigger algs. 22-26 10/18/13 2013/291:21:00:40 Disable soft trigger algs. 22-26 10/21/13 2013/294:17:17:40 Re-enable soft trigger algs. 22-26 10/25/13 2013/298:19:55:40 Disable soft trigger algs. 22-26 10/28/13 2013/301:14:32:40 Re-enable soft trigger algs. 22-26 11/1/13 2013/305:20:35:35 Disable soft trigger algs. 22-26 11/4/13 2013/308:13:23:35 Re-enable soft trigger algs. 22-26 11/8/13 2013/312:19:33:40 Disable soft trigger algs. 22-26 11/12/13 2013/316:15:35:40 Re-enable soft trigger algs. 22-26 11/15/13 2013/319:16:50:40 Disable soft trigger algs. 22-26 11/18/13 2013/322:14:42:40 Re-enable soft trigger algs. 22-26 11/22/13 2013/326:14:06:40 Disable soft trigger algs. 22-26 11/25/13 2013/329:11:57:40 Re-enable soft trigger algs. 22-26 11/27/13 2013/331:22:07:40 Disable soft trigger algs. 22-26 12/2/13 2013/336:19:41:40 Re-enable soft trigger algs. 22-26 12/6/13 2013/340:20:39:40 Disable soft trigger algs. 22-26 12/9/13 2013/343:15:18:40 Re-enable soft trigger algs. 22-26 12/13/13 2013/347:22:58:40 Disable soft trigger algs. 22-26 12/16/13 2013/350:14:08:40 Re-enable soft trigger algs. 22-26 12/20/13 2013/354:20:14:40 Disable soft trigger algs. 22-26

– 47 –

Table 4—Continued

Date Year/DOY/UT Operation

1/2/14 2014/002:13:11:40 Re-enable soft trigger algs. 22-26 1/3/14 2014/003:16:25:40 Disable soft trigger algs. 22-26 1/6/14 2014/006:14:17:40 Re-enable soft trigger algs. 22-26 1/10/14 2014/010:11:58:40 Disable soft trigger algs. 22-26 1/13/14 2014/013:11:31:40 Re-enable soft trigger algs. 22-26 1/17/14 2014/017:19:41:40 Disable soft trigger algs. 22-26 1/21/14 2014/021:17:24:40 Re-enable soft trigger algs. 22-26 1/24/14 2014/024:20:09:40 Disable soft trigger algs. 22-26 1/27/14 2014/027:14:46:40 Re-enable soft trigger algs. 22-26 1/31/14 2014/031:20:47:40 Disable soft trigger algs. 22-26 2/3/14 2014/034:15:14:40 Re-enable soft trigger algs. 22-26 2/4/14 2014/035:16:43:22 Disable soft trigger algs. 22-26 2/7/14 2014/038:19:43:40 Disable soft trigger algs. 22-26 2/10/14 2014/041:14:09:40 Re-enable soft trigger algs. 22-26 2/14/14 2014/045:18:37:40 Disable soft trigger algs. 22-26 2/18/14 2014/049:14:37:40 Re-enable soft trigger algs. 22-26 2/21/14 2014/052:14:10:40 Disable soft trigger algs. 22-26 2/24/14 2014/055:13:42:40 Re-enable soft trigger algs. 22-26 2/28/14 2014/059:21:51:35 Disable soft trigger algs. 22-26 3/3/14 2014/062:19:45:35 Re-enable soft trigger algs. 22-26 3/7/14 2014/066:19:02:40 Disable soft trigger algs. 22-26 3/10/14 2014/069:16:55:40 Re-enable soft trigger algs. 22-26 3/14/14 2014/073:21:10:40 Disable soft trigger algs. 22-26 3/17/14 2014/076:14:05:40 Re-enable soft trigger algs. 22-26 3/21/14 2014/080:20:06:40 Disable soft trigger algs. 22-26 3/24/14 2014/083:12:53:40 Re-enable soft trigger algs. 22-26 3/28/14 2014/087:20:41:40 Disable soft trigger algs. 22-26 3/31/14 2014/090:13:26:40 Re-enable soft trigger algs. 22-26 4/4/14 2014/094:16:10:40 Disable soft trigger algs. 22-26 4/7/14 2014/097:12:20:40 Re-enable soft trigger algs. 22-26 4/11/14 2014/101:13:22:40 Disable soft trigger algs. 22-26 4/14/14 2014/104:11:12:40 Re-enable soft trigger algs. 22-26 4/18/14 2014/108:21:00:40 Disable soft trigger algs. 22-26 4/21/14 2014/111:18:51:40 Re-enable soft trigger algs. 22-26 4/25/14 2014/115:21:25:40 Disable soft trigger algs. 22-26 4/28/14 2014/118:16:00:40 Re-enable soft trigger algs. 22-26 5/2/14 2014/122:22:00:40 Disable soft trigger algs. 22-26 5/5/14 2014/125:13:08:40 Re-enable soft trigger algs. 22-26

– 48 –

Table 4—Continued

Date Year/DOY/UT Operation

5/9/14 2014/129:20:50:35 Disable soft trigger algs. 22-26 5/12/14 2014/132:13:34:35 Re-enable soft trigger algs. 22-26 5/16/14 2014/136:19:43:46 Disable soft trigger algs. 22-26 5/19/14 2014/139:12:28:46 Re-enable soft trigger algs. 22-26 5/23/14 2014/143:15:11:40 Disable soft trigger algs. 22-26 5/27/14 2014/147:12:51:40 Re-enable soft trigger algs. 22-26 5/30/14 2014/150:22:49:40 Disable soft trigger algs. 22-26 6/2/14 2014/153:10:10:40 Re-enable soft trigger algs. 22-26 6/6/14 2014/157:21:34:40 Disable soft trigger algs. 22-26 6/9/14 2014/160:17:48:40 Re-enable soft trigger algs. 22-26 6/12/14 2014/163:16:12:50 Disable soft trigger algs. 22-26 6/13/14 2014/164:20:21:40 Disable soft trigger algs. 22-26 6/16/14 2014/167:14:55:40 Re-enable soft trigger algs. 22-26 6/20/14 2014/171:20:55:40 Disable soft trigger algs. 22-26 6/23/14 2014/174:12:03:40 Re-enable soft trigger algs. 22-26 6/27/14 2014/178:19:46:40 Disable soft trigger algs. 22-26 6/30/14 2014/181:12:29:40 Re-enable soft trigger algs. 22-26

– 49 –

Table 5. GRB Triggers: Locations and Trigger Characteristics

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn080714086 GRB 080714B 02:04:12.0534 41.9 8.5 7.5 Fermi-GBM 10 512 47-291 K bn080714425 GRB 080714C 10:12:01.8376 187.5 -74.0 8.7 Fermi-GBM 17 4096 47-291 bn080714745 GRB 080714A 17:52:54.0234 188.1 -60.2 0.0 Swift 13 1024 47-291 K, R, IA, S, Me, A bn080715950 GRB 080715A 22:48:40.1634 214.7 9.9 2.0 Fermi-GBM 29 256 23-47 K, Me, A bn080717543 GRB 080717A 13:02:35.2207 147.3 -70.0 4.7 Fermi-GBM 17 4096 47-291 bn080719529 GRB 080719A 12:41:40.9578 153.2 -61.3 13.8 Fermi-GBM 16 4096 47-291 K, A bn080720316 GRB 080720A 07:35:35.5476 98.5 -43.9 4.8 Fermi-GBM 19 8192 47-291 bn080723557 GRB 080723B 13:22:21.3751 176.8 -60.2 0.0 Swift 8 256 47-291 K, IA, IS, Me, A bn080723913 GRB 080723C 21:55:23.0583 113.3 -19.7 9.9 Fermi-GBM 5 64 47-291 W bn080723985 GRB 080723D 23:37:42.7083 105.3 71.1 1.0 Fermi-GBM 11 512 47-291 K, IA, Me, W, A bn080724401 GRB 080724A 09:37:40.6034 358.3 32.9 1.6 Fermi-GBM 9 256 47-291 K, R, IA, S, W bn080725435 GRB 080725A 10:26:09.0559 121.7 -14.0 0.0 Swift 4 64 47-291 K, IA, S, Me bn080725541 GRB 080725B 12:59:23.7624 354.8 8.9 3.5 Fermi-GBM 4 64 47-291 K, IA, S, W bn080727964 GRB 080727C 23:07:46.2169 32.6 64.1 0.0 Swift 15 2048 47-291 S, W bn080730520 GRB 080730A 12:29:15.4032 245.4 4.6 2.1 Fermi-GBM 17 4096 47-291 K, W bn080730786 GRB 080730B 18:51:38.1813 246.6 28.7 2.1 Fermi-GBM 4 64 47-291 K, R, Me, W, A bn080802386 GRB 080802A 09:15:10.5274 154.3 40.7 4.1 Fermi-GBM 5 64 47-291 K, IA, W bn080803772 GRB 080803A 18:31:22.0407 300.1 82.8 5.9 Fermi-GBM 14 2048 47-291 K, IA, S, Me, W, A bn080804456 GRB 080804B 10:56:07.1590 107.5 20.3 7.3 Fermi-GBM 17 4096 47-291 K bn080804972 GRB 080804A 23:20:14.8794 328.7 -53.2 0.0 Swift 10 512 47-291 K, R, IA, S, Me bn080805496 GRB 080805B 11:53:50.5646 322.7 47.9 5.6 Fermi-GBM 17 4096 47-291 bn080805584 GRB 080805C 14:01:06.2435 174.5 -23.1 5.7 Fermi-GBM 15 2048 47-291 R bn080806584 GRB 080806A 14:01:11.2038 94.6 57.8 13.6 Fermi-GBM 11 512 47-291 bn080806896 GRB 080806B 21:29:40.8238 241.8 46.7 2.9 Fermi-GBM 39 8192 23-47 K, S, Me, W bn080807993 GRB 080807A 23:50:32.6388 101.7 -16.0 2.6 Fermi-GBM 1 16 47-291 K, IA bn080808451 GRB 080808A 10:50:03.2649 107.4 -33.8 13.6 Fermi-GBM 16 4096 47-291 bn080808565 GRB 080808B 13:33:48.3383 33.6 5.4 2.6 Fermi-GBM 12 1024 47-291 K bn080808772 GRB 080808C 18:31:39.7362 96.7 -14.4 12.3 Fermi-GBM 17 4096 47-291 bn080809808 GRB 080809A 19:23:33.1292 91.7 61.4 7.1 Fermi-GBM 16 4096 47-291 K, W bn080810549 GRB 080810A 13:10:12.5806 356.8 0.3 0.0 Swift 9 256 47-291 K, IA, S

– 50 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn080812889 GRB 080812A 21:19:33.8316 176.7 -33.2 4.1 Fermi-GBM 15 2048 47-291 IA, W bn080815917 GRB 080815A 22:00:05.0847 240.9 -47.8 6.3 Fermi-GBM 7 128 47-291 bn080816503 GRB 080816A 12:04:18.1801 156.2 42.6 2.0 Fermi-GBM 13 1024 47-291 K, Me bn080816989 GRB 080816B 23:43:54.6901 289.5 -6.8 5.3 Fermi-GBM 4 64 47-291 K, IA, Me, W bn080817161 GRB 080817A 03:52:10.5370 148.9 -16.3 1.0 Fermi-GBM 10 512 47-291 K, IA, Me, W, A bn080817720 GRB 080817B 17:17:07.5186 80.2 -17.1 5.7 Fermi-GBM 5 64 47-291 S, Me, W bn080818579 GRB 080818A 13:54:24.8403 60.4 -6.9 6.5 Fermi-GBM 9 256 47-291 bn080818945 GRB 080818B 22:40:49.0790 98.1 7.4 7.3 Fermi-GBM 11 512 47-291 W bn080821332 GRB 080821A 07:57:26.4787 238.6 32.6 3.6 Fermi-GBM 11 512 47-291 K, R, Me bn080823363 GRB 080823A 08:42:13.1426 89.8 -42.4 3.3 Fermi-GBM 16 4096 47-291 W bn080824909 GRB 080824A 21:48:54.7277 122.4 -2.8 1.0 Fermi-GBM 6 128 47-291 K bn080825593 GRB 080825C 14:13:48.1048 234.0 -4.7 1.5 Fermi-GBM 9 256 47-291 K, R, IA, S, Me, A, L bn080828189 GRB 080828B 04:32:11.2646 221.3 -12.3 16.9 Fermi-GBM 8 256 47-291 bn080829790 GRB 080829A 18:57:36.4204 221.9 3.2 4.3 Fermi-GBM 8 256 47-291 K, S bn080830368 GRB 080830A 08:50:16.3344 160.1 30.8 2.5 Fermi-GBM 10 512 47-291 K, R, S, Me bn080831053 GRB 080831A 01:16:14.7521 211.2 -51.7 11.5 Fermi-GBM 3 32 47-291 IA bn080831921 GRB 080831B 22:06:23.1654 259.1 -23.2 2.8 Fermi-GBM 8 256 47-291 K bn080904886 GRB 080904A 21:16:04.7512 214.2 -30.3 2.1 Fermi-GBM 37 4096 23-47 K bn080905499 GRB 080905A 11:58:55.0382 287.7 -18.9 0.0 Swift 2 32 47-291 IA, S, W, A bn080905570 GRB 080905C 13:41:29.3763 96.9 -69.8 8.0 Fermi-GBM 12 1024 47-291 W bn080905705 GRB 080905B 16:55:46.8427 301.7 -62.6 0.0 Swift 12 1024 47-291 IA, S bn080906212 GRB 080906B 05:05:11.5469 182.8 -6.4 1.3 Fermi-GBM 9 256 47-291 K, IA, S, Me, W, A bn080912360 GRB 080912A 08:38:55.9394 25.8 -7.2 7.1 Fermi-GBM 15 2048 47-291 W bn080913735 GRB 080913B 17:38:31.4195 45.1 -3.0 5.9 Fermi-GBM 8 256 47-291 bn080916009 GRB 080916C 00:12:45.6135 119.8 -56.6 0.0 Swift 16 4096 47-291 K, R, IA, Me, A, L bn080916406 GRB 080916A 09:45:18.9384 336.3 -57.0 0.0 Swift 14 2048 47-291 K, IA, S, Me, W bn080919790 GRB 080919B 18:57:35.1052 219.5 44.4 18.1 Fermi-GBM 1 16 47-291 bn080920268 GRB 080920A 06:25:48.8588 121.6 8.9 5.4 Fermi-GBM 17 4096 47-291 IA bn080924766 GRB 080924A 18:22:36.8437 72.8 32.5 4.4 Fermi-GBM 13 1024 47-291 K bn080925775 GRB 080925A 18:35:55.9970 96.1 18.2 1.2 Fermi-GBM 8 256 47-291 K, R, Me, W

– 51 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn080927480 GRB 080927A 11:30:32.1064 61.3 27.4 4.6 Fermi-GBM 13 1024 47-291 K, W bn080928628 GRB 080928A 15:04:56.0478 95.1 -55.2 0.0 Swift 9 256 47-291 bn081003644 GRB 081003C 15:27:17.9319 259.1 35.4 6.9 Fermi-GBM 14 2048 47-291 K, W bn081006604 GRB 081006A 14:29:34.1726 142.0 -67.4 8.0 Fermi-GBM 6 128 47-291 IA, S, W, L bn081006872 GRB 081006B 20:55:35.5945 172.2 -61.0 8.7 Fermi-GBM 10 512 47-291 IA bn081008832 GRB 081008A 19:58:01.7992 280.0 -57.4 0.0 Swift 12 1024 47-291 IA, S, Me, W bn081009140 GRB 081009A 03:20:58.0628 250.5 18.4 1.0 Fermi-GBM 8 256 47-291 K, R, IA, S, Me bn081009690 GRB 081009B 16:33:37.3376 64.6 14.2 2.1 Fermi-GBM 9 256 47-291 bn081012045 GRB 081012B 01:05:22.7830 69.7 4.5 5.4 Fermi-GBM 7 128 47-291 IA bn081012549 GRB 081012A 13:10:23.0326 30.2 -17.6 0.0 Swift 12 1024 47-291 IA, S, Me bn081017474 GRB 081017B 11:22:37.4396 109.0 -15.2 8.0 Fermi-GBM 13 1024 47-291 bn081021398 GRB 081021A 09:33:28.0154 190.3 -25.6 4.1 Fermi-GBM 10 512 47-291 K, R, S, Me bn081022364 GRB 081022A 08:44:44.8470 205.4 16.6 7.9 Fermi-GBM 8 256 47-291 W bn081024245 GRB 081024A 05:53:09.0057 27.9 61.3 0.0 Swift 4 64 47-291 R, IA, S bn081024851 GRB 081024C 20:25:34.1230 145.8 -10.8 4.5 Fermi-GBM 14 2048 47-291 bn081024891 GRB 081024B 21:22:40.8642 322.9 21.2 0.2 Fermi-LAT 4 64 47-291 IA, W, L bn081025349 GRB 081025A 08:23:05.2927 245.4 60.5 0.0 Swift 10 512 47-291 K, R, IA, S, Me, W bn081028538 GRB 081028B 12:55:08.1805 16.0 -27.2 6.9 Fermi-GBM 8 256 47-291 bn081101167 GRB 081101C 04:00:39.6334 213.3 -18.5 8.1 Fermi-GBM 18 8192 47-291 bn081101491 GRB 081101A 11:46:32.0579 95.8 -0.1 0.0 Swift 4 64 47-291 S bn081101532 GRB 081101B 12:45:24.0820 207.5 -28.0 1.1 Fermi-GBM 10 512 47-291 K, IA, S, Me bn081102365 GRB 081102B 08:45:00.5059 225.3 22.0 8.6 Fermi-GBM 4 64 47-291 IA, Me, W, A bn081102739 GRB 081102A 17:44:21.5994 331.2 53.0 0.0 Swift 12 1024 47-291 K, S bn081105614 GRB 081105B 14:43:51.2874 215.8 38.7 11.4 Fermi-GBM 5 64 47-291 bn081107321 GRB 081107A 07:42:01.1149 51.0 17.1 3.5 Fermi-GBM 7 128 47-291 K, R bn081109293 GRB 081109A 07:02:02.4154 330.8 -54.7 0.0 Swift 17 4096 47-291 R, IA, S, W bn081110601 GRB 081110A 14:25:43.0316 111.7 21.4 1.8 Fermi-GBM 56 128 >100 K, IA, S, Me, A bn081113230 GRB 081113A 05:31:32.8973 170.3 56.3 12.4 Fermi-GBM 26 64 23-47 K, IA, S bn081115891 GRB 081115A 21:22:28.1472 190.6 63.3 15.1 Fermi-GBM 8 256 47-291 bn081118876 GRB 081118B 21:00:53.5357 54.6 -43.3 3.6 Fermi-GBM 13 1024 47-291 K, R

– 52 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn081119184 GRB 081119A 04:25:27.0591 346.5 30.0 15.2 Fermi-GBM 10 512 47-291 bn081120618 GRB 081120A 14:49:34.5666 205.4 -9.1 6.0 Fermi-GBM 15 2048 47-291 bn081121858 GRB 081121A 20:35:27.7540 89.3 -60.6 0.0 Swift 14 2048 47-291 Mo, K, IA, S, A bn081122520 GRB 081122A 12:28:12.2113 339.1 40.0 1.0 Fermi-GBM 6 128 47-291 K, R, IA, W, ARR bn081122614 GRB 081122B 14:43:26.2316 151.4 -2.1 11.2 Fermi-GBM 1 16 47-291 bn081124060 GRB 081124A 01:26:10.8478 340.1 -14.6 2.5 Fermi-GBM 34 1024 23-47 K, R, IA bn081125496 GRB 081125A 11:53:39.0035 42.7 -18.9 1.0 Fermi-GBM 9 256 47-291 Mo, K, R, IA, S, W, A bn081126899 GRB 081126A 21:34:09.0649 323.5 48.7 0.0 Swift 9 256 47-291 K, IA, S bn081129161 GRB 081129A 03:52:04.2604 63.2 -54.9 3.0 Fermi-GBM 9 256 47-291 K, R, IA bn081130212 GRB 081130A 05:04:40.7189 34.2 45.4 7.2 Fermi-GBM 26 64 23-47 bn081130629 GRB 081130B 15:05:15.7220 13.2 -5.5 3.8 Fermi-GBM 11 512 47-291 K, W bn081204004 GRB 081204C 00:05:24.2438 63.3 -62.6 4.8 Fermi-GBM 11 512 47-291 K bn081204517 GRB 081204B 12:24:25.7930 150.8 30.5 10.2 Fermi-GBM 1 16 47-291 S bn081206275 GRB 081206A 06:35:53.0181 120.1 32.8 6.4 Fermi-GBM 17 4096 47-291 K, IA, W bn081206604 GRB 081206B 14:29:30.6928 353.3 -31.9 12.6 Fermi-GBM 14 2048 47-291 W bn081206987 GRB 081206C 23:41:50.4689 54.3 -8.6 11.2 Fermi-GBM 15 2048 47-291 IA, W bn081207680 GRB 081207A 16:18:46.9364 112.4 70.5 1.2 Fermi-GBM 12 1024 47-291 K, R, IA, W, A bn081209981 GRB 081209A 23:31:56.3889 45.3 63.5 4.9 Fermi-GBM 1 16 47-291 K, S, A bn081213173 GRB 081213A 04:09:41.6360 12.9 -33.9 13.2 Fermi-GBM 3 32 47-291 IA bn081215784 GRB 081215A 18:48:36.8462 125.6 54.0 1.0 IPN 11 512 47-291 K, R, IA, A bn081215880 GRB 081215B 21:06:53.0399 228.6 -50.7 5.4 Fermi-GBM 8 256 47-291 K, S, W bn081216531 GRB 081216A 12:43:59.9939 129.2 7.6 4.4 Fermi-GBM 6 128 47-291 K, R, IA, S, W bn081217983 GRB 081217A 23:34:49.0146 116.8 26.8 2.0 Fermi-GBM 14 2048 47-291 K, R, IA bn081221681 GRB 081221A 16:21:12.2182 15.8 -24.5 0.0 Swift 8 256 47-291 Mo, K, S bn081222204 GRB 081222A 04:54:00.2557 22.7 -34.1 0.0 Swift 8 256 47-291 Mo, K, R, IA, S, A bn081223419 GRB 081223A 10:03:57.1476 112.5 33.2 3.8 Fermi-GBM 2 32 47-291 IA bn081224887 GRB 081224A 21:17:55.4139 201.7 75.1 1.0 Fermi-GBM 5 64 47-291 K, IA, S, W, A, ARR bn081225257 GRB 081225A 06:09:21.3432 234.1 -64.6 6.9 Fermi-GBM 17 4096 47-291 bn081226044 GRB 081226A 01:03:37.5263 120.5 -69.0 0.0 Swift 7 128 47-291 IA, S bn081226156 GRB 081226C 03:44:52.4146 193.0 26.8 2.4 Fermi-GBM 34 1024 23-47 K

– 53 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn081226509 GRB 081226B 12:13:10.7055 25.5 -47.4 0.0 INTEGRAL 4 64 47-291 IA, IS, S, W bn081229187 GRB 081229A 04:29:01.8801 172.6 56.9 8.8 Fermi-GBM 5 64 47-291 IA bn081229675 GRB 081229B 16:12:17.3755 310.0 22.8 20.7 Fermi-GBM 1 16 47-291 bn081230871 GRB 081230B 20:53:40.9368 207.6 -17.3 7.7 Fermi-GBM 7 128 47-291 bn081231140 GRB 081231A 03:21:01.9340 208.6 -35.8 1.0 Fermi-GBM 10 512 47-291 Mo, K, IA, ARR bn090101758 GRB 090101A 18:11:41.9175 77.8 -31.6 1.2 Fermi-GBM 13 1024 47-291 K, R bn090102122 GRB 090102A 02:55:30.8461 128.2 33.1 0.0 Swift 8 256 47-291 Mo, K, IA, S, A bn090107681 GRB 090107B 16:20:42.7656 284.8 59.6 0.0 INTEGRAL 14 2048 47-291 K, IS, W bn090108020 GRB 090108A 00:29:02.3655 260.8 46.0 3.8 Fermi-GBM 1 16 47-291 K, W bn090108322 GRB 090108B 07:43:23.3598 0.4 -32.9 8.3 Fermi-GBM 3 32 47-291 bn090109332 GRB 090109A 07:58:29.4926 129.6 51.8 9.8 Fermi-GBM 8 256 47-291 bn090112332 GRB 090112A 07:57:23.1109 110.9 -30.4 1.0 Fermi-GBM 10 512 47-291 IA, W bn090112729 GRB 090112B 17:30:15.4538 192.3 25.4 1.7 Fermi-GBM 13 1024 47-291 Mo, K, R, S, Me, W bn090113778 GRB 090113A 18:40:40.8419 32.1 33.4 0.0 Swift 10 512 47-291 S, Me, W bn090117335 GRB 090117B 08:02:02.2267 227.3 -41.5 4.8 Fermi-GBM 10 512 47-291 bn090117632 GRB 090117C 15:10:40.1758 121.6 -38.8 1.9 Fermi-GBM 17 4096 47-291 K, IA, W bn090117640 GRB 090117A 15:22:01.0547 164.0 -58.2 0.0 AGILE 9 256 47-291 K, A bn090120627 GRB 090120A 15:02:22.7594 38.1 -72.2 11.2 Fermi-GBM 11 512 47-291 W bn090126227 GRB 090126B 05:26:22.2341 189.2 34.1 3.6 Fermi-GBM 34 1024 23-47 bn090126245 GRB 090126C 05:52:33.7347 224.9 41.2 11.1 Fermi-GBM 8 256 47-291 W bn090129880 GRB 090129A 21:07:15.4256 269.0 -32.8 0.0 Swift 8 256 47-291 IA, S, Me bn090131090 GRB 090131A 02:09:21.1491 352.3 21.2 1.0 Fermi-GBM 8 256 47-291 Mo, K, R, IA, S, Me, W, A bn090202347 GRB 090202A 08:19:30.4005 274.3 -2.0 2.6 Fermi-GBM 13 1024 47-291 K, IA, Me bn090206620 GRB 090206A 14:52:42.1707 156.2 8.8 8.7 Fermi-GBM 1 16 47-291 R, IA, W bn090207777 GRB 090207A 18:39:10.8373 252.7 34.9 3.8 Fermi-GBM 12 1024 47-291 R, IA, S, Me, W bn090213236 GRB 090213A 05:39:25.4589 330.6 -55.0 3.1 Fermi-GBM 16 4096 47-291 bn090217206 GRB 090217A 04:56:42.5578 204.9 -8.4 0.5 Fermi-LAT 9 256 47-291 Mo, K, R, IA, Me, W, L bn090219074 GRB 090219A 01:46:18.1486 26.5 59.2 5.2 Fermi-GBM 5 64 47-291 IA bn090222179 GRB 090222A 04:17:09.5761 118.6 45.0 4.3 Fermi-GBM 10 512 47-291 bn090225009 GRB 090225A 00:12:23.9776 358.2 61.0 8.7 Fermi-GBM 8 256 47-291 A

– 54 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn090227310 GRB 090227A 07:25:57.0031 3.3 -43.0 1.2 Fermi-GBM 9 256 47-291 Mo, K, R, IA, W bn090227772 GRB 090227B 18:31:01.4069 11.8 32.2 1.8 Fermi-GBM 1 16 47-291 K, IA, Me, W, L, ARR bn090228204 GRB 090228A 04:53:20.9115 106.8 -24.3 1.0 Fermi-GBM 1 16 47-291 Mo, K, R, Me, A, ARR bn090228976 GRB 090228B 23:25:01.0233 357.6 36.7 3.3 Fermi-GBM 9 256 47-291 IA, W bn090301315 GRB 090301B 07:33:37.9783 352.8 9.5 5.0 Fermi-GBM 13 1024 47-291 R, IA, W bn090304216 GRB 090304A 05:10:48.1569 195.9 -73.4 12.3 Fermi-GBM 8 256 47-291 IA, Me bn090305052 GRB 090305B 01:14:35.7277 135.0 74.3 5.4 Fermi-GBM 5 64 47-291 K, IA, Me, A bn090306245 GRB 090306C 05:52:05.3453 137.0 57.0 4.1 Fermi-GBM 14 2048 47-291 bn090307167 GRB 090307B 03:59:57.2490 172.7 -23.9 12.4 Fermi-GBM 17 4096 47-291 bn090308734 GRB 090308B 17:36:24.6992 21.9 -54.3 4.8 Fermi-GBM 7 128 47-291 K, R, IA, S, Me bn090309767 GRB 090309B 18:25:07.1934 174.3 -49.5 3.6 Fermi-GBM 12 1024 47-291 bn090310189 GRB 090310A 04:32:49.9024 184.9 -34.2 4.7 Fermi-GBM 9 256 47-291 bn090316311 GRB 090316A 07:27:42.4470 256.1 -38.9 9.3 Fermi-GBM 4 64 47-291 bn090319622 GRB 090319A 14:55:35.2224 283.3 -8.9 2.6 Fermi-GBM 17 4096 47-291 K, IA, A bn090320045 GRB 090320C 01:05:10.5273 108.3 -43.3 17.9 Fermi-GBM 14 2048 47-291 bn090320418 GRB 090320A 10:01:46.0112 238.0 -46.5 12.0 Fermi-GBM 12 1024 47-291 bn090320801 GRB 090320B 19:13:46.0964 183.4 49.8 9.5 Fermi-GBM 11 512 47-291 K bn090323002 GRB 090323A 00:02:42.6274 190.7 17.1 0.0 Swift 14 2048 47-291 Mo, K, IA, S, Me, L, ARR bn090326633 GRB 090326A 15:10:49.4848 259.7 -7.4 4.0 Fermi-GBM 15 2048 47-291 bn090327404 GRB 090327A 09:41:41.5202 33.1 -41.5 3.1 Fermi-GBM 12 1024 47-291 K, R bn090328401 GRB 090328A 09:36:46.5113 90.9 -42.0 0.0 Swift 14 2048 47-291 K, R, IA, S, Me, A, L, ARR bn090328713 GRB 090328B 17:07:04.9370 155.7 33.4 7.9 Fermi-GBM 1 16 47-291 K, IA, W, A, ARR bn090330279 GRB 090330A 06:42:22.0973 160.2 -8.2 2.1 Fermi-GBM 14 2048 47-291 K, R, Me bn090331681 GRB 090331A 16:20:20.3852 210.5 3.1 9.3 Fermi-GBM 5 64 47-291 IA bn090403314 GRB 090403A 07:32:42.1295 67.1 47.2 9.7 Fermi-GBM 12 1024 47-291 K bn090405663 GRB 090405A 15:54:41.3408 221.9 -9.2 10.4 Fermi-GBM 5 64 47-291 IA, S bn090409288 GRB 090409A 06:54:01.4422 302.1 1.1 9.6 Fermi-GBM 17 4096 47-291 IA bn090411838 GRB 090411A 20:06:36.8889 156.0 -68.9 2.4 Fermi-GBM 6 128 47-291 K, R, IA, S, Me, W bn090411991 GRB 090411B 23:47:44.8754 38.5 5.1 2.4 Fermi-GBM 10 512 47-291 Mo, K, S, W bn090412061 GRB 090412A 01:28:05.2531 1.3 -51.9 10.6 Fermi-GBM 7 128 47-291 IA

– 55 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn090413122 GRB 090413A 02:55:57.2416 266.5 -9.2 5.5 Fermi-GBM 8 256 47-291 K, Me bn090418816 GRB 090418C 19:35:24.9183 262.8 -28.2 14.4 Fermi-GBM 7 128 47-291 IA, W bn090419997 GRB 090419B 23:55:05.0509 88.6 31.3 3.6 Fermi-GBM 15 2048 47-291 K, W bn090422150 GRB 090422A 03:35:17.0668 294.7 40.4 0.0 Swift 10 512 47-291 S bn090423330 GRB 090423A 07:55:25.3942 148.7 18.1 0.0 Swift 16 4096 47-291 S bn090424592 GRB 090424A 14:12:08.6651 189.5 16.8 0.0 Swift 6 128 47-291 K, R, IA, S, Me, W, A bn090425377 GRB 090425A 09:03:30.5674 118.6 68.1 2.1 Fermi-GBM 7 128 47-291 K, R, IA, W bn090426066 GRB 090426B 01:35:35.2251 17.6 -19.2 18.1 Fermi-GBM 14 2048 47-291 bn090426690 GRB 090426C 16:33:33.2023 82.7 -9.7 2.0 Fermi-GBM 9 256 47-291 K, A bn090427644 GRB 090427B 15:27:00.8558 210.0 -45.7 11.8 Fermi-GBM 14 2048 47-291 IA bn090427688 GRB 090427C 16:30:23.8089 356.2 -34.6 5.8 Fermi-GBM 12 1024 47-291 W bn090428441 GRB 090428A 10:34:38.4630 210.1 39.5 4.2 Fermi-GBM 7 128 47-291 bn090428552 GRB 090428B 13:15:11.0554 0.8 11.5 3.9 Fermi-GBM 36 2048 23-47 K, W bn090429530 GRB 090429C 12:43:25.6998 260.0 54.3 4.8 Fermi-GBM 13 1024 47-291 K, IA bn090429753 GRB 090429D 18:03:57.5120 125.2 6.2 4.6 Fermi-GBM 4 64 47-291 K, IA, S bn090502777 GRB 090502A 18:39:34.6476 267.8 -20.3 7.4 Fermi-GBM 9 256 47-291 bn090509215 GRB 090509A 05:10:05.7161 241.4 -28.4 0.0 Swift 15 2048 47-291 K, IA, S, W bn090510016 GRB 090510A 00:22:59.9711 333.6 -26.6 0.0 Swift 1 16 47-291 Mo, K, IA, S, Me, W, A, L, ARR bn090510325 GRB 090510B 07:47:39.5123 269.4 -57.9 11.6 Fermi-GBM 8 256 47-291 K bn090511684 GRB 090511A 16:25:16.3719 161.9 51.3 7.0 Fermi-GBM 15 2048 47-291 K, IA bn090513916 GRB 090513A 21:58:47.9205 269.8 -31.6 4.6 Fermi-GBM 15 2048 47-291 IA bn090513941 GRB 090513B 22:35:35.3399 99.1 -72.9 8.8 Fermi-GBM 14 2048 47-291 bn090514006 GRB 090514A 00:08:39.1570 12.3 -10.9 4.6 Fermi-GBM 10 512 47-291 K, Me, W bn090514726 GRB 090514B 17:26:07.3322 304.3 -24.4 5.5 Fermi-GBM 9 256 47-291 K, IA, S, Me, W bn090514734 GRB 090514C 17:36:55.2927 316.0 -44.0 15.2 Fermi-GBM 17 4096 47-291 bn090516137 GRB 090516B 03:17:20.1691 122.2 -71.6 2.6 Fermi-GBM 15 2048 47-291 K, S, Me, W, A bn090516353 GRB 090516A 08:27:58.3477 138.3 -11.9 0.0 Swift 17 4096 47-291 S bn090516853 GRB 090516C 20:28:40.0468 15.7 -13.7 3.5 Fermi-GBM 5 64 47-291 K, IA, Me bn090518080 GRB 090518A 01:54:44.5170 119.9 0.8 0.0 Swift 11 512 47-291 K, S bn090518244 GRB 090518B 05:51:04.6687 211.2 -16.7 4.5 Fermi-GBM 6 128 47-291 K, IA, Me, W

– 56 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn090519462 GRB 090519B 11:05:27.5445 105.9 -56.7 3.9 Fermi-GBM 13 1024 47-291 R bn090519881 GRB 090519A 21:08:45.8729 142.3 0.2 0.0 Swift 15 2048 47-291 S bn090520832 GRB 090520B 19:57:53.9759 332.0 43.2 12.0 Fermi-GBM 8 256 47-291 bn090520850 GRB 090520C 20:23:19.3082 111.2 -19.7 1.2 Fermi-GBM 9 256 47-291 K, Me, W bn090520876 GRB 090520D 21:01:37.1455 131.3 -18.0 4.3 Fermi-GBM 33 1024 23-47 bn090522344 GRB 090522A 08:15:49.3265 277.7 19.6 4.9 Fermi-GBM 12 1024 47-291 K bn090524346 GRB 090524A 08:17:56.2335 329.5 -67.4 1.3 Fermi-GBM 10 512 47-291 K, IA, Me bn090528173 GRB 090528A 04:09:01.1410 134.9 -35.8 1.0 Fermi-GBM 15 2048 47-291 K, W bn090528516 GRB 090528B 12:22:31.2864 312.2 32.7 1.0 Fermi-GBM 14 2048 47-291 K, IA, S, Me, W, A bn090529310 GRB 090529B 07:26:22.4114 231.2 32.2 7.2 Fermi-GBM 8 256 47-291 K bn090529564 GRB 090529C 13:32:00.4878 162.7 47.3 1.5 Fermi-GBM 4 64 47-291 Mo, K, IA, W, ARR bn090530760 GRB 090530B 18:14:24.4343 73.2 13.8 1.0 Fermi-GBM 12 1024 47-291 K, IA, Me, W bn090531775 GRB 090531B 18:35:56.4921 252.1 -36.0 0.0 Swift 5 64 47-291 IA, S, W, A, L bn090602564 GRB 090602A 13:32:22.8543 248.9 -65.0 3.4 Fermi-GBM 11 512 47-291 K, IA, S, W bn090606471 GRB 090606A 11:18:08.0027 146.9 -70.5 5.6 Fermi-GBM 15 2048 47-291 Me bn090608052 GRB 090608A 01:15:26.5975 100.2 -37.4 4.5 Fermi-GBM 14 2048 47-291 bn090610648 GRB 090610A 15:33:25.9360 84.2 35.4 5.2 Fermi-GBM 10 512 47-291 K, IA, S, Me, W, A bn090610723 GRB 090610B 17:21:31.9045 276.0 -42.1 9.5 Fermi-GBM 17 4096 47-291 K bn090610883 GRB 090610C 21:12:07.7336 70.4 30.3 8.2 Fermi-GBM 14 2048 47-291 bn090612619 GRB 090612A 14:50:50.4940 81.0 17.7 2.2 Fermi-GBM 6 128 47-291 K, S, Me, A bn090616157 GRB 090616A 03:45:42.5323 103.1 -3.7 10.4 Fermi-GBM 9 256 47-291 bn090617208 GRB 090617A 04:59:58.5756 78.9 15.6 4.2 Fermi-GBM 1 16 47-291 K, IA, S, Me, W, A, ARR bn090618353 GRB 090618A 08:28:26.6590 294.0 78.4 0.0 Swift 10 512 47-291 Mo, K, R, IA, S, W, A bn090620400 GRB 090620A 09:36:23.4676 237.4 61.2 1.0 Fermi-GBM 8 256 47-291 Mo, K, R, IA, Me, A bn090620901 GRB 090620B 21:37:35.7510 241.4 -43.0 8.3 Fermi-GBM 10 512 47-291 bn090621185 GRB 090621A 04:26:34.4877 11.0 61.9 0.0 Swift 14 2048 47-291 bn090621417 GRB 090621C 10:00:52.0963 257.5 -28.5 3.2 Fermi-GBM 15 2048 47-291 R bn090621447 GRB 090621D 10:43:45.1445 12.3 -22.6 6.5 Fermi-GBM 12 1024 47-291 bn090621922 GRB 090621B 22:07:25.7006 313.4 69.0 0.1 Swift 1 16 47-291 K, S bn090623107 GRB 090623A 02:34:17.5618 309.0 -43.2 2.0 Fermi-GBM 4 64 47-291 Mo, K, IA, S, W

– 57 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn090623913 GRB 090623B 21:54:25.1132 41.7 1.8 1.5 Fermi-GBM 10 512 47-291 K, W bn090625234 GRB 090625A 05:37:00.2090 20.3 -6.4 3.1 Fermi-GBM 14 2048 47-291 IA bn090625560 GRB 090625B 13:26:22.5142 2.3 -65.8 0.0 Swift 17 4096 47-291 K, IS, W bn090626189 GRB 090626A 04:32:08.8802 170.0 -33.5 0.3 Fermi-LAT 11 512 47-291 Mo, K, R, IA, S, Me, W, L bn090626707 GRB 090626B 16:58:45.4643 136.4 14.4 7.7 Fermi-GBM 12 1024 47-291 W bn090629543 GRB 090629A 13:01:21.7834 8.5 17.7 7.4 Fermi-GBM 17 4096 47-291 bn090630311 GRB 090630A 07:27:21.1663 146.6 -46.6 5.8 Fermi-GBM 8 256 47-291 bn090701225 GRB 090701A 05:23:55.8438 114.7 -42.1 4.2 Fermi-GBM 12 1024 47-291 bn090703329 GRB 090703A 07:54:02.4773 0.8 9.7 5.2 Fermi-GBM 13 1024 47-291 bn090704242 GRB 090704A 05:47:48.1849 208.2 22.8 0.0 INTEGRAL 15 2048 47-291 R, IS bn090704783 GRB 090704B 18:47:00.6224 296.4 25.9 6.3 Fermi-GBM 17 4096 47-291 K, IA bn090706283 GRB 090706A 06:47:40.4279 205.1 -47.1 3.0 Fermi-GBM 17 4096 47-291 S bn090708152 GRB 090708A 03:38:18.4565 154.6 26.6 0.1 Swift 17 4096 47-291 S bn090709630 GRB 090709B 15:07:41.1367 93.6 64.1 0.1 Swift 12 1024 47-291 K, S bn090711850 GRB 090711A 20:23:22.9192 139.6 -64.7 1.0 Fermi-GBM 13 1024 47-291 IA, W bn090712160 GRB 090712A 03:51:00.3413 70.1 22.5 0.0 Swift 17 4096 47-291 K, S, W bn090713020 GRB 090713A 00:29:28.0600 284.8 -3.3 2.4 Fermi-GBM 14 2048 47-291 K, W bn090717034 GRB 090717A 00:49:32.1084 92.4 -62.5 1.2 Fermi-GBM 11 512 47-291 Mo, K, IA, S, W, A bn090717111 GRB 090717B 02:40:31.7864 246.9 23.0 3.9 Fermi-GBM 8 256 47-291 IA, W, A bn090718720 GRB 090718A 17:16:42.9331 243.8 -6.7 5.9 Fermi-GBM 14 2048 47-291 bn090718762 GRB 090718B 18:17:42.8414 274.1 -36.4 1.2 Fermi-GBM 10 512 47-291 Mo, K, S bn090719063 GRB 090719A 01:31:26.6117 341.3 -67.9 1.0 Fermi-GBM 6 128 47-291 Mo, K, A bn090720276 GRB 090720A 06:38:08.2827 199.5 -16.4 5.0 Fermi-GBM 7 128 47-291 K, R, IA, S bn090720710 GRB 090720B 17:02:56.9051 203.0 -54.8 2.9 Fermi-GBM 1 16 47-291 K, IA, W, A, L, ARR bn090725838 GRB 090725A 20:06:20.5520 281.9 -69.5 6.6 Fermi-GBM 17 4096 47-291 bn090726218 GRB 090726B 05:14:07.0692 240.4 36.8 7.1 Fermi-GBM 13 1024 47-291 W bn090730608 GRB 090730A 14:35:07.6683 252.6 30.5 3.7 Fermi-GBM 9 256 47-291 K bn090802235 GRB 090802A 05:39:03.0822 84.3 34.1 3.9 Fermi-GBM 1 16 47-291 K, R, IA, S, A bn090802666 GRB 090802B 15:58:23.4438 267.0 -71.8 10.7 Fermi-GBM 12 1024 47-291 bn090804940 GRB 090804A 22:33:20.0192 130.4 -11.3 1.0 Fermi-GBM 4 64 47-291 K, IA, S, Me, W

– 58 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn090805622 GRB 090805A 14:55:18.2387 300.0 -50.8 11.0 Fermi-GBM 12 1024 47-291 bn090807832 GRB 090807B 19:57:59.0173 326.9 7.2 2.6 Fermi-GBM 25 64 23-47 S bn090809978 GRB 090809B 23:28:14.6113 95.2 0.2 1.2 Fermi-GBM 15 2048 47-291 K, R, IA, Me, A bn090810659 GRB 090810A 15:49:07.8220 168.9 -76.4 5.5 Fermi-GBM 14 2048 47-291 K, W bn090810781 GRB 090810B 18:44:44.8577 116.4 -17.5 2.8 Fermi-GBM 12 1024 47-291 K bn090811696 GRB 090811A 16:41:50.0382 277.0 22.2 7.5 Fermi-GBM 6 128 47-291 K, Me bn090813174 GRB 090813A 04:10:42.5926 225.8 88.6 0.0 Swift 8 256 47-291 Mo, K, IA, S, W, ARR bn090814368 GRB 090814C 08:49:41.2219 332.5 58.9 5.5 Fermi-GBM 4 64 47-291 K, IA, Me, A bn090814950 GRB 090814D 22:47:28.7773 307.6 45.7 2.1 Fermi-GBM 16 4096 47-291 K, S, Me bn090815300 GRB 090815A 07:12:12.4482 41.0 -2.7 7.8 Fermi-GBM 15 2048 47-291 IA bn090815438 GRB 090815B 10:30:41.8488 21.4 53.4 5.7 Fermi-GBM 15 2048 47-291 K bn090815946 GRB 090815D 22:41:46.5997 251.3 52.9 2.3 Fermi-GBM 17 4096 47-291 S bn090817036 GRB 090817A 00:51:26.2058 64.0 44.1 0.0 INTEGRAL 9 256 47-291 K, IS, S, W bn090819607 GRB 090819A 14:34:27.4683 49.1 -67.1 3.3 Fermi-GBM 4 64 47-291 IA bn090820027 GRB 090820A 00:38:16.1887 87.7 27.1 1.0 Fermi-GBM 8 256 47-291 K, R, IA, S, W, A, ARR bn090820509 GRB 090820B 12:13:16.7003 318.3 -18.6 9.6 Fermi-GBM 9 256 47-291 bn090823133 GRB 090823B 03:10:53.7641 49.5 -17.6 10.4 Fermi-GBM 12 1024 47-291 S bn090824918 GRB 090824A 22:02:19.1051 46.7 59.8 12.2 Fermi-GBM 36 2048 23-47 K bn090826068 GRB 090826A 01:37:31.8544 140.6 -0.1 9.7 Fermi-GBM 12 1024 47-291 W bn090828099 GRB 090828A 02:22:48.1994 124.4 -26.1 1.2 Fermi-GBM 15 2048 47-291 K, IA, S, Me, W, A bn090829672 GRB 090829A 16:07:38.8640 329.2 -34.2 1.0 Fermi-GBM 12 1024 47-291 Mo, K, S, Me, W, A, ARR bn090829702 GRB 090829B 16:50:40.1331 355.0 -9.4 3.2 Fermi-GBM 13 1024 47-291 R, Me bn090831317 GRB 090831A 07:36:36.5826 145.1 51.0 1.9 Fermi-GBM 1 16 47-291 K, IA, W, M bn090902401 GRB 090902A 09:38:05.4940 291.0 53.1 3.8 Fermi-GBM 8 256 47-291 IA, S, W bn090902462 GRB 090902B 11:05:08.3127 264.9 27.3 0.0 Swift 6 128 47-291 R, IA, S, W, L, ARR bn090904058 GRB 090904B 01:24:13.9373 264.2 -25.2 0.1 Swift 12 1024 47-291 K, IA, S, W bn090904581 GRB 090904C 13:57:17.1254 261.6 4.6 2.5 Fermi-GBM 10 512 47-291 K, W bn090907017 GRB 090907A 00:24:09.7163 86.3 -38.8 2.1 Fermi-GBM 12 1024 47-291 bn090907808 GRB 090907B 19:23:47.4742 81.1 20.5 4.1 Fermi-GBM 5 64 47-291 K bn090908314 GRB 090908A 07:31:52.0875 282.2 3.5 8.0 Fermi-GBM 17 4096 47-291 K

– 59 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn090908341 GRB 090908B 08:10:39.8143 174.1 -25.1 4.6 Fermi-GBM 9 256 47-291 K, IA, S, Me bn090909487 GRB 090909A 11:41:17.1795 32.3 53.9 8.1 Fermi-GBM 13 1024 47-291 K, W bn090909854 GRB 090909B 20:29:52.7396 54.2 -25.0 8.3 Fermi-GBM 5 64 47-291 IA bn090910812 GRB 090910A 19:29:48.8069 296.2 72.3 1.0 Fermi-GBM 12 1024 47-291 K, Me bn090912660 GRB 090912A 15:50:29.1033 188.0 61.5 0.0 Swift 12 1024 47-291 K, S, W bn090915650 GRB 090915A 15:35:35.6511 238.0 15.5 0.0 Swift 13 1024 47-291 K, S, W bn090917661 GRB 090917A 15:51:38.9418 230.3 -11.7 5.9 Fermi-GBM 8 256 47-291 W, ARR bn090920035 GRB 090920A 00:49:59.0621 299.7 -52.2 5.7 Fermi-GBM 18 8192 47-291 K bn090922539 GRB 090922A 12:56:42.1373 17.2 74.3 1.0 Fermi-GBM 12 1024 47-291 K, R, Me, W, A, ARR bn090922605 GRB 090922B 14:30:41.5287 38.4 -73.1 3.3 Fermi-GBM 4 64 47-291 K, R, Me, W bn090924625 GRB 090924A 14:59:54.0113 69.7 -65.0 7.1 Fermi-GBM 5 64 47-291 IA, ARR bn090925389 GRB 090925A 09:20:33.6723 333.2 14.3 4.4 Fermi-GBM 15 2048 47-291 K, R, Me, W bn090926181 GRB 090926A 04:20:26.9865 353.4 -66.3 0.0 Swift 8 256 47-291 Mo, K, R, IA, S, Me, W, A, L, ARR bn090926914 GRB 090926B 21:55:28.5250 46.3 -39.0 0.1 Swift 13 1024 47-291 K, S, Me, M bn090927422 GRB 090927A 10:07:17.2136 344.0 -71.0 0.1 Swift 6 128 47-291 IA, S, W bn090928646 GRB 090928A 15:29:44.6648 103.9 -43.5 8.9 Fermi-GBM 8 256 47-291 K, Me, W bn090929190 GRB 090929A 04:33:03.9663 51.7 -7.3 1.3 Fermi-GBM 2 32 47-291 K, R, IA, S, W bn091002685 GRB 091002A 16:26:11.1643 41.9 -14.0 4.2 Fermi-GBM 8 256 47-291 bn091003191 GRB 091003A 04:35:45.5846 251.5 36.6 0.0 Swift 6 128 47-291 K, IA, S, Me, W, A, L, ARR bn091005679 GRB 091005A 16:17:30.4905 43.1 12.1 5.1 Fermi-GBM 12 1024 47-291 bn091006360 GRB 091006A 08:38:46.9285 243.1 -31.0 12.9 Fermi-GBM 8 256 47-291 bn091010113 GRB 091010A 02:43:09.3213 298.7 -22.5 0.1 AGILE 30 256 23-47 K, X, IA, Me, W, A, ARR bn091012783 GRB 091012A 18:47:02.7698 109.4 87.3 2.5 Fermi-GBM 4 64 47-291 K, IA, S, W, A bn091015129 GRB 091015B 03:05:42.9372 316.1 -49.5 12.6 Fermi-GBM 35 2048 23-47 bn091017861 GRB 091017A 20:40:24.2971 210.8 25.5 8.5 Fermi-GBM 12 1024 47-291 W bn091017985 GRB 091017B 23:38:57.4707 214.4 -64.7 1.7 Fermi-GBM 14 2048 47-291 W bn091018957 GRB 091018B 22:58:20.6027 321.8 -23.1 13.1 Fermi-GBM 5 64 47-291 IA bn091019750 GRB 091019A 18:00:40.8812 226.0 80.3 12.8 Fermi-GBM 2 32 47-291 bn091020900 GRB 091020A 21:36:43.8167 175.7 51.0 0.0 Swift 8 256 47-291 Mo, K, IA, S bn091020977 GRB 091020B 23:26:34.4485 187.8 -13.4 2.2 Fermi-GBM 5 64 47-291 Mo, K, S

– 60 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn091023021 GRB 091023A 00:29:44.5452 215.4 26.0 7.2 Fermi-GBM 11 512 47-291 W bn091024372^b GRB 091024A 08:55:58.4721 339.3 56.9 0.0 Swift 11 512 47-291 K, R, IA, S, ARR bn091024380^b GRB 091024A 09:06:29.3574 339.3 56.9 0.0 Swift 16 4096 47-291 bn091026485 GRB 091026B 11:38:48.5224 137.1 -23.6 8.1 Fermi-GBM 12 1024 47-291 K, W bn091026550 GRB 091026A 13:11:33.0196 276.6 -86.1 0.0 Swift 16 4096 47-291 K, IA, S bn091030613 GRB 091030B 14:43:16.4358 249.0 23.5 5.6 Fermi-GBM 10 512 47-291 K, W bn091030828 GRB 091030A 19:52:26.8633 41.7 21.5 1.2 Fermi-GBM 9 256 47-291 K, R, W bn091031500 GRB 091031A 12:00:28.8460 70.6 -59.1 1.0 Fermi-GBM 8 256 47-291 Mo, K, S, W, L bn091101143 GRB 091101A 03:26:32.4886 29.8 -33.7 2.2 Fermi-GBM 8 256 47-291 K, R, W bn091102607 GRB 091102A 14:34:38.3625 72.6 -72.5 0.0 Swift 11 512 47-291 K, S, W bn091103912 GRB 091103A 21:53:51.4847 170.6 11.3 2.4 Fermi-GBM 8 256 47-291 K, W bn091106762 GRB 091106A 18:17:12.8908 49.1 60.3 5.6 Fermi-GBM 15 2048 47-291 K bn091107635 GRB 091107A 15:13:59.6296 182.4 38.9 4.5 Fermi-GBM 10 512 47-291 K, W bn091109895 GRB 091109C 21:28:40.0122 247.7 42.3 4.1 Fermi-GBM 8 256 47-291 K, W bn091112737 GRB 091112A 17:41:15.8218 257.7 -36.7 0.1 Swift 10 512 47-291 K, S, W bn091112928 GRB 091112B 22:15:51.1902 208.4 37.2 4.5 Fermi-GBM 11 512 47-291 K bn091115177 GRB 091115A 04:14:50.4195 307.8 71.5 7.9 Fermi-GBM 17 4096 47-291 K bn091117080 GRB 091117B 01:55:24.8969 246.5 -73.9 6.8 Fermi-GBM 17 4096 47-291 bn091120191 GRB 091120A 04:34:40.2297 226.8 -21.8 0.5 MAXI 6 128 47-291 Mo, K, R, IA, A, M, ARR bn091122163 GRB 091122A 03:54:20.3750 110.9 0.6 18.0 Fermi-GBM 10 512 47-291 IA bn091123081 GRB 091123B 01:55:59.7529 337.8 13.4 5.9 Fermi-GBM 10 512 47-291 K, IA bn091123298 GRB 091123A 07:08:37.2603 297.1 -29.2 2.4 Fermi-GBM 14 2048 47-291 K, IA, W, A bn091126333 GRB 091126A 07:59:24.7624 83.2 -19.3 5.4 Fermi-GBM 1 16 47-291 K, IA, W bn091126389 GRB 091126B 09:19:48.5326 47.4 31.5 14.3 Fermi-GBM 1 16 47-291 IA bn091127976 GRB 091127A 23:25:45.4830 36.6 -19.0 0.0 Swift 4 64 47-291 Mo, K, R, IA, S, W, ARR bn091128285 GRB 091128A 06:50:34.6410 127.7 1.7 1.4 Fermi-GBM 11 512 47-291 K, R, IA, A bn091201089 GRB 091201A 02:07:32.9477 27.8 11.9 11.4 Fermi-GBM 17 4096 47-291 bn091202072 GRB 091202B 01:44:06.5285 257.5 -1.9 12.1 Fermi-GBM 10 512 47-291 K, W bn091202219 GRB 091202C 05:15:42.6582 13.9 9.1 5.8 Fermi-GBM 15 2048 47-291 S bn091207333 GRB 091207A 08:00:10.1058 12.7 -50.2 1.6 Fermi-GBM 8 256 47-291 K, IA

– 61 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn091208410 GRB 091208B 09:49:57.9560 29.4 16.9 0.0 Swift 9 256 47-291 K, R, IA, S, L, ARR bn091209001 GRB 091209A 00:00:44.8977 261.0 38.3 2.9 Fermi-GBM 14 2048 47-291 K bn091215234 GRB 091215A 05:37:26.8650 283.2 17.5 9.8 Fermi-GBM 12 1024 47-291 K bn091219462 GRB 091219A 11:04:45.4947 294.5 71.9 5.4 Fermi-GBM 9 256 47-291 K, W bn091220442 GRB 091220A 10:36:50.6362 166.8 4.8 1.8 Fermi-GBM 8 256 47-291 K, W bn091221870 GRB 091221A 20:52:57.2170 55.8 23.2 0.0 Swift 17 4096 47-291 Mo, K, R, IA, S, Me, W bn091223191 GRB 091223A 04:35:10.3547 203.2 76.3 8.9 Fermi-GBM 9 256 47-291 IA, S bn091223511 GRB 091223B 12:15:53.6895 231.3 54.7 2.4 Fermi-GBM 14 2048 47-291 K, S bn091224373 GRB 091224A 08:57:36.5574 331.2 18.3 15.6 Fermi-GBM 5 64 47-291 bn091227294 GRB 091227A 07:03:13.3858 296.9 2.6 3.6 Fermi-GBM 8 256 47-291 Mo, K, Me bn091230260 GRB 091230B 06:14:09.3592 101.5 0.7 18.0 Fermi-GBM 17 4096 47-291 bn091230712 GRB 091230C 17:05:14.0175 51.7 77.2 5.1 Fermi-GBM 12 1024 47-291 K bn091231206 GRB 091231A 04:56:33.4876 199.4 -60.7 1.7 Fermi-GBM 13 1024 47-291 K, S, Me bn091231540 GRB 091231B 12:57:48.5805 241.3 3.3 12.6 Fermi-GBM 17 4096 47-291 bn100101028 GRB 100101A 00:39:49.3357 307.3 -27.0 17.4 Fermi-GBM 8 256 47-291 IA bn100101988 GRB 100101B 23:42:15.1827 70.7 18.7 9.3 Fermi-GBM 10 512 47-291 Mo, IA, S bn100107074 GRB 100107A 01:46:31.8646 6.3 -21.2 6.0 Fermi-GBM 4 64 47-291 IA bn100111176 GRB 100111A 04:12:49.6954 247.0 15.6 0.0 Swift 10 512 47-291 Mo, K, IA, S, W bn100112418 GRB 100112A 10:01:17.5551 240.1 -75.1 14.8 Fermi-GBM 17 4096 47-291 bn100116897 GRB 100116A 21:31:00.2421 305.0 14.4 0.3 Fermi-LAT 6 128 47-291 K, R, IA, Me, W, L bn100117879 GRB 100117A 21:06:19.6634 11.3 -1.6 0.1 Swift 4 64 47-291 IA, S bn100118100 GRB 100118A 02:23:33.6983 9.3 -37.4 5.9 Fermi-GBM 14 2048 47-291 K, R, IA, Me, W bn100122616 GRB 100122A 14:47:37.3141 79.2 -2.7 1.3 Fermi-GBM 14 2048 47-291 Mo, K, R, IA, Me, ARR bn100126460 GRB 100126A 11:03:05.1248 338.4 -18.7 18.3 Fermi-GBM 13 1024 47-291 S bn100130729 GRB 100130A 17:29:24.1447 21.2 -24.8 2.5 Fermi-GBM 16 4096 47-291 K, IA, W bn100130777 GRB 100130B 18:38:35.4634 78.6 20.8 2.4 Fermi-GBM 14 2048 47-291 Mo, K, R, Me, W bn100131730 GRB 100131A 17:30:57.6702 120.4 16.5 1.2 Fermi-GBM 6 128 47-291 Mo, K, IA, S, Me, W, ARR bn100201588 GRB 100201A 14:06:17.5047 133.1 -37.3 4.3 Fermi-GBM 17 4096 47-291 K, IA bn100204024 GRB 100204A 00:33:53.5451 50.8 -47.9 3.0 Fermi-GBM 15 2048 47-291 K, W bn100204566 GRB 100204B 13:34:43.3753 273.1 -52.8 5.7 Fermi-GBM 17 4096 47-291 W

– 62 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn100204858 GRB 100204C 20:36:03.7668 91.3 -20.9 16.6 Fermi-GBM 9 256 47-291 bn100205490 GRB 100205B 11:45:38.2585 133.9 -23.0 8.2 Fermi-GBM 13 1024 47-291 K, R, IA, Me bn100206563 GRB 100206A 13:30:05.3902 47.2 13.2 0.0 Swift 1 16 47-291 K, IA, S, W, ARR bn100207665 GRB 100207A 15:57:54.7648 307.9 -27.7 4.7 Fermi-GBM 14 2048 47-291 K, W bn100207721 GRB 100207B 17:18:29.7243 321.8 -15.8 1.0 Fermi-GBM 17 4096 47-291 bn100208386 GRB 100208A 09:15:33.9419 260.2 27.5 29.3 Fermi-GBM 4 64 47-291 IA bn100210101 GRB 100210A 02:24:49.4680 244.4 16.1 6.1 Fermi-GBM 13 1024 47-291 K bn100211440 GRB 100211A 10:33:35.1692 132.2 29.5 2.5 Fermi-GBM 17 4096 47-291 Mo, K, R, Me, W bn100212550 GRB 100212B 13:11:45.4691 134.3 32.2 1.4 Fermi-GBM 4 64 47-291 K, IA, Me, A bn100212588 GRB 100212A 14:07:22.2949 1.8 46.0 5.0 Fermi-GBM 10 512 47-291 S bn100216422 GRB 100216A 10:07:00.1874 154.3 35.5 0.0 Swift 4 64 47-291 S bn100218194 GRB 100218A 04:38:45.9326 206.6 -11.9 2.2 Fermi-GBM 16 4096 47-291 K bn100219026 GRB 100219B 00:37:14.7600 330.9 37.8 2.9 Fermi-GBM 8 256 47-291 K bn100221368 GRB 100221A 08:50:26.4858 27.1 -17.4 8.0 Fermi-GBM 14 2048 47-291 bn100223110 GRB 100223A 02:38:09.3064 104.5 3.7 7.8 Fermi-GBM 1 16 47-291 Mo, K, IA, S, Me, W, A bn100224112 GRB 100224B 02:40:55.4771 269.6 -17.1 1.6 Fermi-GBM 15 2048 47-291 Mo, K, IA, S, Me, W bn100225115 GRB 100225A 02:45:31.1468 310.3 -59.4 0.9 Fermi-LAT 8 256 47-291 K, IA, S, Me, W, L bn100225249 GRB 100225B 05:59:05.4719 352.9 15.0 18.8 Fermi-GBM 17 4096 47-291 W bn100225580 GRB 100225C 13:55:31.3431 314.3 0.2 1.1 Fermi-GBM 13 1024 47-291 K, Me, W bn100225703 GRB 100225D 16:52:18.1160 147.9 34.0 3.9 Fermi-GBM 10 512 47-291 Mo, K, Me, W bn100228544 GRB 100228A 13:02:41.2829 199.8 15.6 9.3 Fermi-GBM 17 4096 47-291 bn100228873 GRB 100228B 20:57:47.6684 118.0 18.6 11.1 Fermi-GBM 14 2048 47-291 bn100301068 GRB 100301A 01:37:18.6335 110.1 -15.7 7.3 Fermi-GBM 2 32 47-291 bn100301223 GRB 100301B 05:21:46.1881 201.9 19.8 4.9 Fermi-GBM 8 256 47-291 K bn100304004 GRB 100304A 00:05:20.7140 76.2 60.5 3.3 Fermi-GBM 12 1024 47-291 K, W bn100304534 GRB 100304B 12:48:18.5604 260.1 -21.9 2.5 Fermi-GBM 15 2048 47-291 K bn100306199 GRB 100306A 04:46:25.7418 216.0 -29.4 17.1 Fermi-GBM 16 4096 47-291 bn100307928 GRB 100307A 22:16:30.2268 129.4 33.0 4.1 Fermi-GBM 10 512 47-291 bn100311518 GRB 100311A 12:25:54.1120 303.4 -27.8 5.0 Fermi-GBM 13 1024 47-291 K bn100313288 GRB 100313A 06:54:23.2203 172.7 -52.6 2.9 Fermi-GBM 10 512 47-291 Mo, K, Me

– 63 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn100313509 GRB 100313B 12:12:17.2943 186.4 11.7 9.6 Fermi-GBM 16 4096 47-291 bn100315361 GRB 100315A 08:39:12.7417 208.9 30.1 5.5 Fermi-GBM 16 4096 47-291 bn100318611 GRB 100318A 14:39:24.6047 211.0 21.2 10.7 Fermi-GBM 13 1024 47-291 bn100322045 GRB 100322A 01:05:09.6426 23.3 -10.2 1.2 Fermi-GBM 10 512 47-291 K, IA, Me, W bn100323542 GRB 100323A 13:00:44.7544 188.9 -18.7 4.2 Fermi-GBM 14 2048 47-291 K, W bn100324172 GRB 100324B 04:07:36.4874 39.7 -19.3 0.1 IPN 4 64 47-291 Mo, K, Me, W bn100325246 GRB 100325B 05:54:43.9487 209.1 -79.1 7.2 Fermi-GBM 11 512 47-291 S bn100325275 GRB 100325A 06:36:08.0232 330.2 -26.5 0.9 Fermi-LAT 9 256 47-291 K, IA, S, Me, L bn100326294 GRB 100326A 07:03:05.5029 131.2 -28.2 12.6 Fermi-GBM 9 256 47-291 S, A bn100326402 GRB 100326B 09:38:20.0441 314.7 0.5 2.4 Fermi-GBM 12 1024 47-291 K, Me bn100328141 GRB 100328A 03:22:44.6049 155.9 47.0 4.8 Fermi-GBM 5 64 47-291 bn100330309 GRB 100330A 07:24:51.7257 202.1 -0.9 2.5 Fermi-GBM 8 256 47-291 K, Me bn100330856 GRB 100330B 20:32:48.2692 326.4 -7.0 7.7 Fermi-GBM 12 1024 47-291 bn100401297 GRB 100401A 07:07:32.2415 290.8 -8.3 0.0 Swift 9 256 47-291 S, W bn100406758 GRB 100406A 18:11:25.7765 77.8 26.9 6.5 Fermi-GBM 10 512 47-291 bn100410356 GRB 100410A 08:31:57.4695 130.0 21.5 10.8 Fermi-GBM 17 4096 47-291 bn100410740 GRB 100410B 17:45:46.6619 78.1 61.3 1.7 Fermi-GBM 10 512 47-291 Mo, K, S, Me, W bn100411516 GRB 100411A 12:22:57.3442 210.6 47.9 31.6 Fermi-GBM 4 64 47-291 bn100413732 GRB 100413A 17:33:31.9243 266.2 15.8 0.0 Swift 14 2048 47-291 K, IA, S, Me, W bn100414097 GRB 100414A 02:20:21.9864 192.1 8.7 0.0 Swift 8 256 47-291 Mo, K, Me, W, L, ARR bn100417166 GRB 100417A 03:59:43.7283 261.3 50.4 9.2 Fermi-GBM 1 16 47-291 bn100417789 GRB 100417B 18:55:40.2857 295.8 9.8 9.4 Fermi-GBM 16 4096 47-291 bn100420008 GRB 100420B 00:12:06.5986 120.6 -5.8 2.8 Fermi-GBM 8 256 47-291 K, W bn100421917 GRB 100421A 21:59:48.3903 350.7 -25.7 2.4 Fermi-GBM 16 4096 47-291 K, Me, W bn100423244 GRB 100423B 05:51:25.7503 119.7 5.8 1.5 Fermi-GBM 14 2048 47-291 Mo, K, Me, A bn100424729 GRB 100424B 17:30:10.1284 246.7 -48.9 4.1 Fermi-GBM 13 1024 47-291 W bn100424876 GRB 100424C 21:01:52.5901 7.8 43.3 2.4 Fermi-GBM 15 2048 47-291 K, IA, Me, W bn100427356 GRB 100427A 08:32:08.7061 89.2 -3.5 0.4 Swift 12 1024 47-291 K, S, Me, W bn100429999 GRB 100429A 23:59:51.6396 89.1 -70.0 4.0 Fermi-GBM 12 1024 47-291 IA, W bn100502356 GRB 100502A 08:33:02.9425 131.0 18.4 2.2 Fermi-GBM 13 1024 47-291 K, Me, W

– 64 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn100503554 GRB 100503A 13:18:03.8897 147.5 4.0 1.5 Fermi-GBM 16 4096 47-291 K, R, IA, Me bn100504806 GRB 100504A 19:20:55.5358 255.6 -35.6 0.0 Swift 17 4096 47-291 S bn100506653 GRB 100506A 15:39:49.2949 82.5 59.2 5.0 Fermi-GBM 14 2048 47-291 K, R, W bn100507577 GRB 100507A 13:51:15.7277 2.9 -79.0 2.5 Fermi-GBM 11 512 47-291 K, R bn100510810 GRB 100510A 19:27:06.9690 355.8 -35.6 0.1 MAXI 15 2048 47-291 R, M bn100511035 GRB 100511A 00:49:56.2302 109.3 -4.7 1.0 Fermi-GBM 11 512 47-291 K, R, Me, ARR bn100513879 GRB 100513B 21:05:57.6687 321.0 22.2 2.5 Fermi-GBM 13 1024 47-291 R, IA bn100515467 GRB 100515A 11:13:09.0369 275.5 27.0 2.2 Fermi-GBM 9 256 47-291 Mo, K, R, IA, W bn100516369 GRB 100516A 08:50:41.0629 274.4 -8.2 18.4 Fermi-GBM 4 64 47-291 IA bn100516396 GRB 100516B 09:30:38.3170 297.7 18.7 13.7 Fermi-GBM 8 256 47-291 bn100517072 GRB 100517B 01:43:08.1081 100.9 -29.0 3.8 Fermi-GBM 25 64 23-47 R, S bn100517132 GRB 100517C 03:09:50.1229 40.6 -44.3 5.2 Fermi-GBM 8 256 47-291 W bn100517154 GRB 100517D 03:42:08.0552 243.6 -10.4 4.2 Fermi-GBM 5 64 47-291 Me bn100517243 GRB 100517E 05:49:52.1020 10.4 4.4 11.8 Fermi-GBM 12 1024 47-291 W bn100517639 GRB 100517F 15:19:58.0246 52.7 -71.9 2.1 Fermi-GBM 11 512 47-291 K, R, W bn100519204 GRB 100519A 04:53:22.7069 191.5 57.4 1.0 Fermi-GBM 10 512 47-291 Mo, K, Me bn100522157 GRB 100522A 03:45:52.2937 7.0 9.4 0.0 Swift 7 128 47-291 K, R, IA, S, W bn100525744 GRB 100525A 17:51:25.0814 251.8 41.0 3.5 Fermi-GBM 4 64 47-291 S, W bn100527795 GRB 100527A 19:04:37.2416 226.8 19.8 1.9 Fermi-GBM 17 4096 47-291 K, Me, W bn100528075 GRB 100528A 01:48:01.1097 311.1 27.8 0.1 AGILE 12 1024 47-291 Mo, K, IA, Me, W, A, ARR bn100530737 GRB 100530A 17:41:51.2263 289.7 31.0 11.6 Fermi-GBM 12 1024 47-291 K bn100604287 GRB 100604A 06:53:34.8147 248.3 -73.2 3.6 Fermi-GBM 13 1024 47-291 K, IA, Me, W bn100605774 GRB 100605A 18:35:10.7438 273.4 -67.6 7.7 Fermi-GBM 13 1024 47-291 bn100608382 GRB 100608A 09:10:06.3394 30.5 20.5 5.3 Fermi-GBM 17 4096 47-291 bn100609783 GRB 100609A 18:48:11.3268 90.5 42.8 2.5 Fermi-GBM 14 2048 47-291 Mo, K bn100612545 GRB 100612A 13:04:21.6560 63.5 13.7 2.7 Fermi-GBM 5 64 47-291 K, A bn100612726 GRB 100612B 17:26:06.1270 352.0 -1.8 1.6 Fermi-GBM 8 256 47-291 Mo, K, S, Me, W, A bn100614498 GRB 100614B 11:57:23.3061 224.8 40.9 3.0 Fermi-GBM 16 4096 47-291 W bn100615083 GRB 100615A 01:59:04.3714 177.2 -19.5 0.0 Swift 9 256 47-291 K, IA, S, Me, W bn100616773 GRB 100616A 18:32:32.8957 342.9 3.1 45.7 Fermi-GBM 9 256 47-291

– 65 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn100619015 GRB 100619A 00:21:07.0260 86.4 -27.0 0.1 Swift 10 512 47-291 R, S, W bn100620119 GRB 100620A 02:51:29.1134 80.1 -51.7 1.5 Fermi-GBM 13 1024 47-291 Mo, K, IA, Me, W, L bn100621452 GRB 100621B 10:51:18.2595 103.8 37.3 2.8 Fermi-GBM 12 1024 47-291 K bn100621529 GRB 100621C 12:42:16.4305 160.9 14.7 11.4 Fermi-GBM 11 512 47-291 IA bn100625773 GRB 100625A 18:32:28.4721 15.8 -39.1 0.0 Swift 5 64 47-291 Mo, K, IA, S, Me, W, A bn100625891 GRB 100625B 21:22:45.1845 338.3 20.3 4.4 Fermi-GBM 14 2048 47-291 K, S, W bn100629801 GRB 100629A 19:14:03.3527 231.2 27.8 3.3 Fermi-GBM 6 128 47-291 Mo, K, IA, S, Me, W bn100701490 GRB 100701B 11:45:23.0690 43.1 -2.2 0.1 IPN 5 64 47-291 K, IA, Me, W bn100704149 GRB 100704A 03:35:06.1029 133.6 -24.2 0.0 Swift 8 256 47-291 K, IA, S bn100706693 GRB 100706A 16:38:18.9243 255.2 46.9 12.2 Fermi-GBM 6 128 47-291 bn100707032 GRB 100707A 00:46:38.9870 351.1 -6.6 1.0 Fermi-GBM 4 64 47-291 Mo, K, Me, W bn100709602 GRB 100709A 14:27:32.9828 142.5 17.4 4.5 Fermi-GBM 8 256 47-291 Mo, K, R, IA, W bn100713980 GRB 100713B 23:31:34.0130 82.1 13.0 3.7 Fermi-GBM 9 256 47-291 Mo, K, R, IA, S, Me, W, A bn100714672 GRB 100714A 16:07:23.7779 106.4 51.1 3.7 Fermi-GBM 9 256 47-291 IA bn100714686 GRB 100714B 16:27:20.0776 307.9 61.3 9.7 Fermi-GBM 4 64 47-291 K, IA, W bn100715477 GRB 100715A 11:27:17.6396 299.3 -54.7 9.3 Fermi-GBM 15 2048 47-291 IA bn100717372 GRB 100717A 08:55:06.2119 287.1 -0.7 8.8 Fermi-GBM 7 128 47-291 IA, S, Me bn100717446 GRB 100717B 10:41:47.1184 304.3 19.5 9.2 Fermi-GBM 4 64 47-291 IA bn100718160 GRB 100718B 03:50:09.6065 121.8 -46.2 5.9 Fermi-GBM 11 512 47-291 IA, W bn100718796 GRB 100718A 19:06:22.5770 298.5 41.4 10.2 Fermi-GBM 12 1024 47-291 K bn100719311 GRB 100719B 07:28:17.6230 304.9 -67.1 15.4 Fermi-GBM 13 1024 47-291 IA bn100719825 GRB 100719C 19:48:08.0933 231.4 18.6 10.3 Fermi-GBM 9 256 47-291 IA bn100719989 GRB 100719D 23:44:04.1293 113.3 5.4 1.0 Fermi-GBM 15 2048 47-291 K, IA, S, Me bn100722096 GRB 100722A 02:18:37.2418 238.8 -15.6 1.1 Fermi-GBM 6 128 47-291 K, IA, S, Me, W, ARR bn100722291 GRB 100722B 06:58:24.7237 31.8 56.2 8.1 Fermi-GBM 8 256 47-291 IA, W bn100724029 GRB 100724A 00:42:05.9915 119.6 75.9 0.9 Fermi-LAT 10 512 47-291 Mo, K, R, IA, S, Me, W, A, L, ARR bn100725475 GRB 100725B 11:24:34.8929 290.0 77.0 0.0 Swift 16 4096 47-291 K, R, IA, S, W bn100727238 GRB 100727A 05:42:21.9977 154.2 -21.4 0.1 Swift 17 4096 47-291 IA, S, W bn100728095 GRB 100728A 02:17:30.6106 88.8 -15.3 0.0 Swift 16 4096 47-291 K, R, IA, S, Me, W, L, ARR bn100728439 GRB 100728B 10:31:54.9742 44.1 0.3 0.1 Swift 10 512 47-291 K, R, S, Me

– 66 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn100730463 GRB 100730A 11:06:14.9678 339.8 -22.2 5.4 Fermi-GBM 17 4096 47-291 Mo, K, R, IA bn100802240 GRB 100802A 05:45:35.6759 2.5 47.8 0.0 Swift 11 512 47-291 S, W bn100804104 GRB 100804A 02:29:26.3476 249.0 27.5 1.0 Fermi-GBM 11 512 47-291 Mo, K, IA, S bn100805300 GRB 100805B 07:12:12.4770 22.8 34.2 7.7 Fermi-GBM 4 64 47-291 IA bn100805845 GRB 100805C 20:16:29.5284 112.7 -35.9 3.8 Fermi-GBM 6 128 47-291 K, Me bn100810049 GRB 100810A 01:10:34.2426 124.8 -1.6 5.7 Fermi-GBM 13 1024 47-291 bn100811108 GRB 100811A 02:35:49.3632 345.9 15.9 6.0 Fermi-GBM 5 64 47-291 Mo, K, R, IA, Me bn100811781 GRB 100811B 18:44:09.2966 108.1 62.2 3.6 Fermi-GBM 9 256 47-291 K, Me bn100814160 GRB 100814A 03:50:08.8091 22.5 -18.0 0.0 Swift 6 128 47-291 K, IA, S, Me, W bn100814351 GRB 100814B 08:25:25.7462 122.8 18.5 2.6 Fermi-GBM 10 512 47-291 K, S, Me, W bn100816009 GRB 100816B 00:12:41.4152 102.1 -26.7 1.1 Fermi-GBM 17 4096 47-291 K, IA, Me, W bn100816026 GRB 100816A 00:37:50.9438 351.7 26.6 0.0 Swift 4 64 47-291 Mo, K, IA, S, Me bn100819498 GRB 100819A 11:56:35.2617 279.6 -50.0 3.9 Fermi-GBM 12 1024 47-291 K, IA bn100820373 GRB 100820A 08:56:58.4744 258.8 -18.5 2.1 Fermi-GBM 2 32 47-291 K, IA, S, Me bn100825287 GRB 100825A 06:53:48.6698 253.4 -56.6 6.3 Fermi-GBM 12 1024 47-291 Mo bn100826957 GRB 100826A 22:58:22.8984 284.0 -23.2 1.0 Fermi-GBM 15 2048 47-291 Mo, K, Me, W, L, ARR bn100827455 GRB 100827A 10:55:49.3332 193.9 71.9 5.7 Fermi-GBM 5 64 47-291 K, R, IA, W, A bn100829374 GRB 100829B 08:59:07.0227 115.4 -4.0 4.7 Fermi-GBM 12 1024 47-291 K, R, IA, S, Me, W bn100829876 GRB 100829A 21:02:08.9901 90.4 30.3 0.2 IPN 5 64 47-291 Mo, K, R, S, Me bn100831651 GRB 100831A 15:37:25.9432 161.3 33.7 10.2 Fermi-GBM 14 2048 47-291 K, IA bn100902990 GRB 100902B 23:45:19.2230 306.0 42.3 7.2 Fermi-GBM 12 1024 47-291 K, IA bn100905907 GRB 100905B 21:46:22.9886 262.6 13.1 4.0 Fermi-GBM 9 256 47-291 K, IA, W bn100906576 GRB 100906A 13:49:27.6296 28.7 55.6 0.0 Swift 8 256 47-291 K, IA, S bn100907751 GRB 100907A 18:01:11.6350 177.3 -40.6 6.9 Fermi-GBM 13 1024 47-291 bn100910818 GRB 100910A 19:37:43.9632 238.1 -34.6 1.0 Fermi-GBM 9 256 47-291 Mo, K, S, Me, ARR bn100911816 GRB 100911A 19:35:39.9046 151.3 59.0 11.8 Fermi-GBM 11 512 47-291 IA, S, W bn100915243 GRB 100915B 05:49:39.6161 85.4 25.1 0.0 INTEGRAL 13 1024 47-291 R, IS bn100916779 GRB 100916A 18:41:12.4932 152.0 -59.4 3.5 Fermi-GBM 4 64 47-291 K bn100918863 GRB 100918A 20:42:18.0153 308.4 -46.0 1.0 Fermi-GBM 14 2048 47-291 Mo, K, R, IA, Me, W bn100919884 GRB 100919A 21:12:16.2807 163.2 6.0 1.8 Fermi-GBM 12 1024 47-291 K, IA, Me, W

– 67 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn100922625 GRB 100922A 14:59:43.0094 357.0 -25.2 15.0 Fermi-GBM 8 256 47-291 S, Me bn100923844 GRB 100923A 20:15:10.6695 106.1 39.6 5.3 Fermi-GBM 8 256 47-291 K, IA bn100924165 GRB 100924A 03:58:08.3174 0.7 7.0 0.0 Swift 9 256 47-291 Mo, K, IA, S, W bn100926595 GRB 100926A 14:17:03.9427 222.8 -72.3 3.8 Fermi-GBM 9 256 47-291 K, Me, W bn100926694 GRB 100926B 16:39:54.5159 43.6 -11.1 12.0 Fermi-GBM 17 4096 47-291 R, IA bn100929235 GRB 100929A 05:38:52.4951 166.3 62.3 13.4 Fermi-GBM 14 2048 47-291 IA, W bn100929315 GRB 100929B 07:33:04.0476 243.6 33.3 23.8 Fermi-GBM 11 512 47-291 IA bn100929916 GRB 100929C 21:59:45.8208 183.0 -24.9 7.8 Fermi-GBM 2 32 47-291 IA, Me bn101002279 GRB 101002A 06:41:26.9461 323.4 -27.5 16.4 Fermi-GBM 16 4096 47-291 IA bn101003244 GRB 101003A 05:51:08.0080 175.9 2.5 7.4 Fermi-GBM 10 512 47-291 K, S bn101004426 GRB 101004A 10:13:49.4556 232.2 -44.0 7.3 Fermi-GBM 16 4096 47-291 bn101008697 GRB 101008A 16:43:15.6089 328.9 37.1 0.0 Swift 9 256 47-291 K, R, IA, S, Me, W bn101010190 GRB 101010A 04:33:46.8303 47.2 43.6 18.6 Fermi-GBM 14 2048 47-291 IA bn101011707 GRB 101011A 16:58:36.5335 48.3 -66.0 2.4 Swift 12 1024 47-291 IA, S bn101013412 GRB 101013A 09:52:42.8813 292.1 -49.6 1.6 Fermi-GBM 10 512 47-291 Mo, K, R, IA, Me, W bn101014175 GRB 101014A 04:11:52.6218 26.9 -51.1 1.0 Fermi-GBM 6 128 47-291 K, IA, Me, W, A, L bn101015558 GRB 101015A 13:24:02.6672 73.2 15.5 5.9 Fermi-GBM 14 2048 47-291 K, IA bn101016243 GRB 101016A 05:50:16.0722 133.0 -4.6 2.8 Fermi-GBM 5 64 47-291 Mo, K, IA, W bn101017619 GRB 101017B 14:51:29.4836 27.5 -26.6 4.9 Fermi-GBM 12 1024 47-291 Mo, IA, W bn101021009 GRB 101021A 00:13:25.3558 0.9 -23.7 1.3 Fermi-GBM 15 2048 47-291 Mo, K, R, S, Me bn101021063 GRB 101021B 01:30:31.6578 0.5 47.3 12.8 Fermi-GBM 6 128 47-291 IA, S bn101023951 GRB 101023A 22:50:04.7270 318.0 -65.4 0.0 Swift 17 4096 47-291 Mo, K, IA, S, Me, W, ARR bn101024486 GRB 101024A 11:39:33.6020 66.5 -77.3 0.0 Swift 17 4096 47-291 K, IA, S, Me, W bn101025146 GRB 101025A 03:30:18.6429 240.2 -8.5 24.4 Fermi-GBM 14 2048 47-291 ARR bn101026034 GRB 101026A 00:49:16.1400 263.7 -0.4 7.6 Fermi-GBM 1 16 47-291 K, IA bn101027230 GRB 101027A 05:30:30.7617 79.0 44.0 11.4 Fermi-GBM 5 64 47-291 bn101030664 GRB 101030A 15:56:30.7162 166.4 -16.4 0.0 Swift 16 4096 47-291 S bn101031625 GRB 101031A 14:59:32.7269 184.1 -7.5 15.9 Fermi-GBM 4 64 47-291 W bn101101744 GRB 101101A 17:51:34.0237 13.6 45.8 3.1 Fermi-GBM 10 512 47-291 bn101101899 GRB 101101B 21:34:08.9031 266.0 -29.0 5.4 Fermi-GBM 17 4096 47-291 IA, W

– 68 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn101102840 GRB 101102A 20:10:07.4299 284.7 -37.0 7.8 Fermi-GBM 15 2048 47-291 IA bn101104810 GRB 101104A 19:26:14.0512 161.0 -7.1 8.5 Fermi-GBM 5 64 47-291 K, R, IA, S, W bn101107011 GRB 101107A 00:16:25.1173 168.3 22.4 4.1 Fermi-GBM 14 2048 47-291 K, R, IA, W bn101112924 GRB 101112A 22:10:32.4495 292.2 39.4 0.0 INTEGRAL 9 256 47-291 K, R, IS, Me bn101112984 GRB 101112B 23:36:55.8111 100.1 9.6 5.1 Fermi-GBM 17 4096 47-291 W bn101113483 GRB 101113A 11:35:36.3981 29.1 0.2 2.7 Fermi-GBM 9 256 47-291 K, IA, S, Me bn101116481 GRB 101116A 11:32:26.7371 32.0 -81.2 7.3 Fermi-GBM 5 64 47-291 IA bn101117496 GRB 101117C 11:54:45.7539 57.2 -26.9 1.8 Fermi-GBM 14 2048 47-291 K, IA, Me bn101119685 GRB 101119A 16:27:02.6578 226.5 59.6 16.2 Fermi-GBM 7 128 47-291 IA, W bn101123952 GRB 101123A 22:51:34.9735 135.2 1.9 1.0 Fermi-GBM 15 2048 47-291 Mo, K, IA, S, Me, A, L bn101126198 GRB 101126A 04:44:27.4773 84.8 -22.6 1.0 Fermi-GBM 16 4096 47-291 Mo, K, IA, S, Me, ARR bn101127093 GRB 101127A 02:13:59.0697 290.3 7.9 23.2 Fermi-GBM 13 1024 47-291 bn101127102 GRB 101127B 02:27:30.9027 70.9 -11.3 6.6 Fermi-GBM 8 256 47-291 R, IA, S, Me bn101128322 GRB 101128A 07:44:04.2384 145.5 -35.2 5.7 Fermi-GBM 15 2048 47-291 K bn101129652 GRB 101129A 15:39:31.6576 157.8 -17.2 4.6 Fermi-GBM 5 64 47-291 Mo, K, IA, S, Me, W bn101129726 GRB 101129B 17:25:25.3404 271.5 1.0 8.2 Fermi-GBM 8 256 47-291 Mo, K, IA, S, W bn101130074 GRB 101130B 01:45:54.3465 274.6 26.6 23.6 Fermi-GBM 16 4096 47-291 bn101201418 GRB 101201A 10:01:49.7402 2.0 -16.2 0.0 Swift 10 512 47-291 Mo, K, IA, S, Me, W bn101202154 GRB 101202A 03:41:53.8380 254.0 58.5 6.1 Fermi-GBM 10 512 47-291 K, IA bn101204343 GRB 101204B 08:14:18.6046 191.9 55.7 10.4 Fermi-GBM 1 16 47-291 IA, S bn101205309 GRB 101205A 07:24:24.8622 322.1 -39.1 11.1 Fermi-GBM 17 4096 47-291 IA bn101206036 GRB 101206A 00:52:17.5301 164.1 -38.1 3.5 Fermi-GBM 13 1024 47-291 K, IA, W bn101207536 GRB 101207A 12:51:41.3141 175.8 8.7 3.7 Fermi-GBM 12 1024 47-291 R, IA, S, Me bn101208203 GRB 101208A 04:52:56.9155 212.4 4.0 11.7 Fermi-GBM 6 128 47-291 IA bn101208498 GRB 101208B 11:57:01.1980 280.9 -59.0 1.4 Fermi-GBM 6 128 47-291 Mo, K, R, IA, S, Me bn101211485 GRB 101211A 11:37:54.5157 31.8 10.1 11.2 Fermi-GBM 12 1024 47-291 bn101213451 GRB 101213A 10:49:20.7987 241.3 21.9 0.0 Swift 13 1024 47-291 Mo, K, IA, S, Me, W bn101213849 GRB 101213B 20:22:26.2667 261.0 -64.5 7.1 Fermi-GBM 4 64 47-291 IA bn101214748 GRB 101214A 17:57:03.9723 0.7 -28.3 5.6 Fermi-GBM 2 32 47-291 S bn101214993 GRB 101214A 23:50:00.9707 181.1 -31.1 5.7 Fermi-GBM 11 512 47-291 K, R, IA, S

– 69 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn101216721 GRB 101216A 17:17:52.5437 284.3 -21.0 2.1 Fermi-GBM 7 128 47-291 Mo, K, IA, S, Me bn101219686 GRB 101219B 16:28:13.1208 12.2 -34.6 0.0 Swift 16 4096 47-291 S bn101220576 GRB 101220A 13:49:58.1328 241.6 46.1 1.2 Fermi-GBM 15 2048 47-291 K, R bn101220864 GRB 101220B 20:43:54.1195 2.7 27.2 1.5 Fermi-GBM 13 1024 47-291 Mo, K, IA, W bn101223834 GRB 101223A 20:00:18.0962 250.6 48.2 4.3 Fermi-GBM 16 4096 47-291 K, W bn101224227 GRB 101224A 05:27:13.8616 285.9 45.7 0.1 Swift 4 64 47-291 S bn101224578 GRB 101224B 13:52:58.2245 289.1 -55.2 4.8 Fermi-GBM 9 256 47-291 K, W bn101224614 GRB 101224C 14:43:32.9295 290.2 34.5 8.9 Fermi-GBM 16 4096 47-291 K bn101224998 GRB 101224D 23:57:34.9417 325.2 -38.7 8.3 Fermi-GBM 12 1024 47-291 bn101225377 GRB 101225B 09:02:53.4978 60.7 32.8 1.8 Fermi-GBM 16 4096 47-291 Mo, K, R, IA, S, W bn101227195 GRB 101227A 04:40:28.7163 186.8 -83.5 7.2 Fermi-GBM 8 256 47-291 K, IA, W bn101227406 GRB 101227B 09:45:06.5683 240.5 -24.5 1.6 Fermi-GBM 11 512 47-291 Mo, K, Me, W bn101227536 GRB 101227C 12:51:46.1930 150.9 -49.4 2.6 Fermi-GBM 9 256 47-291 Mo, K, Me, W bn101231067 GRB 101231A 01:36:50.6108 191.7 17.6 1.4 Fermi-GBM 6 128 47-291 Mo, K, IA, Me bn110101202 GRB 110101A 04:50:20.4790 264.3 36.5 11.2 Fermi-GBM 10 512 47-291 IA, S bn110101506 GRB 110101B 12:08:21.5756 105.5 34.6 16.5 Fermi-GBM 16 4096 47-291 bn110102788 GRB 110102A 18:54:36.0066 245.9 7.6 0.0 Swift 9 256 47-291 ARR bn110105877 GRB 110105A 21:02:39.5976 85.1 -17.1 2.0 Fermi-GBM 12 1024 47-291 Mo, K, R, IA, S, Me bn110106893 GRB 110106B 21:26:16.0782 134.2 47.0 0.1 Swift 17 4096 47-291 K, IA, S bn110107886 GRB 110107A 21:15:51.7986 299.1 42.0 3.3 Fermi-GBM 11 512 47-291 K, R, S, W bn110108977 GRB 110108A 23:26:18.5151 11.6 -9.6 2.7 Fermi-GBM 12 1024 47-291 IA, Me bn110112934 GRB 110112B 22:24:55.2904 10.6 64.4 0.0 INTEGRAL 4 64 47-291 IS bn110117364 GRB 110117A 08:44:50.8029 130.9 47.6 9.6 Fermi-GBM 15 2048 47-291 S, W bn110117626 GRB 110117B 15:01:27.6317 129.5 -12.9 3.6 Fermi-GBM 9 256 47-291 R, IA, S bn110118857 GRB 110118A 20:34:18.7914 226.6 -39.5 4.1 Fermi-GBM 8 256 47-291 K, IA, Me, W bn110119931 GRB 110119A 22:21:00.1678 348.6 6.0 0.0 Swift 14 2048 47-291 K, IA, S, W bn110120666 GRB 110120A 15:59:39.2285 61.6 -12.0 0.4 Fermi-LAT 9 256 47-291 K, IA, S, Me, W, L, ARR bn110123804 GRB 110123A 19:17:45.0445 247.0 28.0 1.2 Fermi-GBM 8 256 47-291 Mo, K, R, IA, S, Me bn110124784 GRB 110124A 18:49:09.0701 53.8 36.3 9.1 Fermi-GBM 14 2048 47-291 bn110125894 GRB 110125A 21:27:28.3942 331.4 -46.2 5.8 Fermi-GBM 10 512 47-291

– 70 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn110128073 GRB 110128A 01:44:36.4388 193.9 28.1 0.0 Swift 14 2048 47-291 S bn110130230 GRB 110130A 05:31:52.5817 111.5 38.2 6.8 Fermi-GBM 10 512 47-291 bn110131780 GRB 110131A 18:42:38.5734 183.8 72.9 14.5 Fermi-GBM 8 256 47-291 IA bn110201399 GRB 110201A 09:35:10.2515 137.6 88.6 0.0 Swift 14 2048 47-291 S bn110204179 GRB 110204A 04:17:11.3723 1.8 -17.4 4.0 Fermi-GBM 14 2048 47-291 K, S, Me, W bn110205027 GRB 110205B 00:39:04.6507 359.7 -80.4 9.2 Fermi-GBM 13 1024 47-291 W bn110205588 GRB 110205C 14:07:20.0120 312.7 -55.9 10.1 Fermi-GBM 17 4096 47-291 K, IA, W bn110206202 GRB 110206B 04:50:36.0612 333.7 1.6 15.5 Fermi-GBM 12 1024 47-291 bn110207470 GRB 110207A 11:17:20.2873 12.5 -10.8 0.0 Swift 4 64 47-291 S, W bn110207959 GRB 110207B 23:00:26.4059 179.0 -58.4 9.0 Fermi-GBM 11 512 47-291 bn110209165 GRB 110209A 03:58:08.2980 329.7 -21.9 10.6 Fermi-GBM 16 4096 47-291 W bn110212550 GRB 110212B 13:12:33.5227 311.3 -74.5 4.3 Fermi-GBM 1 16 47-291 K, IA, S, W, ARR bn110213220 GRB 110213A 05:17:11.2720 43.0 49.3 0.1 Swift 15 2048 47-291 K, R, S, Me bn110213876 GRB 110213C 21:00:51.3417 6.3 27.5 10.8 Fermi-GBM 7 128 47-291 S bn110217591 GRB 110217A 14:10:46.5313 274.7 32.3 8.5 Fermi-GBM 14 2048 47-291 K bn110220761 GRB 110220A 18:16:21.6289 185.5 16.6 6.1 Fermi-GBM 11 512 47-291 IA, S bn110221244 GRB 110221A 05:51:19.3637 15.2 66.1 1.2 Fermi-GBM 12 1024 47-291 IA, Me, W bn110226989 GRB 110226A 23:44:31.1326 199.3 35.8 7.1 Fermi-GBM 13 1024 47-291 K, IA bn110227009 GRB 110227A 00:12:28.2262 148.7 -54.0 11.9 Fermi-GBM 8 256 47-291 IA bn110227229 GRB 110227B 05:30:10.8216 25.2 15.9 7.4 Fermi-GBM 12 1024 47-291 K, S, W bn110227420 GRB 110227C 10:04:12.5524 232.7 -9.9 5.0 Fermi-GBM 13 1024 47-291 IA, Me bn110228011 GRB 110228A 00:15:58.9081 10.3 -45.7 2.6 Fermi-GBM 15 2048 47-291 K, IA, S, W bn110228792 GRB 110228B 18:59:50.3907 245.1 16.4 4.7 Fermi-GBM 17 4096 47-291 IA, S, W bn110301214 GRB 110301A 05:08:43.0699 229.4 29.4 1.0 Fermi-GBM 4 64 47-291 K, IA, S, Me, W, A, ARR bn110302043 GRB 110302A 01:01:51.7323 122.3 2.9 6.8 Fermi-GBM 10 512 47-291 bn110304071 GRB 110304A 01:42:33.7986 322.9 33.3 4.2 Fermi-GBM 6 128 47-291 K, IA, W bn110307972 GRB 110307A 23:19:08.2578 193.1 15.6 7.6 Fermi-GBM 5 64 47-291 IA bn110311812 GRB 110311A 19:29:21.4165 117.6 34.3 9.7 Fermi-GBM 12 1024 47-291 IA bn110316139 GRB 110316A 03:19:41.8631 46.7 -67.6 17.8 Fermi-GBM 6 128 47-291 bn110318552 GRB 110318A 13:14:16.7008 338.3 -15.3 0.0 Swift 17 4096 47-291 Mo, IA, S

– 71 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn110319628 GRB 110319C 15:04:45.4603 208.0 -51.6 4.9 Fermi-GBM 14 2048 47-291 IA bn110319815 GRB 110319B 19:34:02.2948 325.6 -57.1 6.8 Fermi-GBM 12 1024 47-291 IA, S bn110321346 GRB 110321A 08:17:42.4849 13.3 -21.8 11.8 Fermi-GBM 16 4096 47-291 Mo bn110322558 GRB 110322A 13:23:42.8132 99.0 -48.9 4.7 Fermi-GBM 12 1024 47-291 IA bn110328520 GRB 110328B 12:29:19.1942 117.7 43.1 1.7 Fermi-LAT 16 4096 47-291 K, R, IA, S, Me, W, L bn110331604 GRB 110331A 14:29:06.8443 6.7 26.0 4.7 Fermi-GBM 10 512 47-291 IA, S bn110401920 GRB 110401A 22:04:19.6333 268.6 26.9 3.8 Fermi-GBM 5 64 47-291 K, IA, S, A bn110402009 GRB 110402A 00:12:58.5426 197.4 61.2 0.1 Swift 9 256 47-291 K, IA, S, Me, W bn110407998 GRB 110407B 23:56:57.0598 97.4 -11.9 1.0 Fermi-GBM 11 512 47-291 K, IA, Me bn110409179 GRB 110409A 04:17:20.6001 238.7 -34.3 10.9 Fermi-GBM 2 32 47-291 IA, W bn110410133 GRB 110410A 03:10:52.4268 30.9 -15.9 3.7 Fermi-GBM 13 1024 47-291 bn110410772 GRB 110410B 18:31:19.8814 337.2 -22.0 17.4 Fermi-GBM 11 512 47-291 bn110411629 GRB 110411B 15:05:15.3503 210.3 -65.0 6.3 Fermi-GBM 14 2048 47-291 K, IA bn110412315 GRB 110412A 07:33:35.7064 133.5 13.5 0.1 Swift 13 1024 47-291 K, S bn110413938 GRB 110413A 22:31:09.1604 352.7 32.3 11.6 Fermi-GBM 13 1024 47-291 K, IA, W bn110415541 GRB 110415A 12:59:22.9542 213.8 9.1 9.2 Fermi-GBM 8 256 47-291 K, IA, S, Me bn110420946 GRB 110420B 22:42:11.7338 320.0 -41.3 0.0 Swift 1 16 47-291 IA, S bn110421757 GRB 110421A 18:10:39.9182 277.2 50.8 1.7 Fermi-GBM 16 4096 47-291 K, IA, Me bn110422029 GRB 110422B 00:41:48.5550 226.7 43.0 21.5 Fermi-GBM 5 64 47-291 bn110424758 GRB 110424A 18:11:36.6464 293.3 -11.1 12.4 Fermi-GBM 5 64 47-291 IA bn110426629 GRB 110426A 15:06:26.6132 219.9 -8.7 2.1 Fermi-GBM 16 4096 47-291 K, IA bn110428338 GRB 110428B 08:07:05.2455 128.4 19.9 2.9 Fermi-GBM 13 1024 47-291 K, W bn110428388 GRB 110428A 09:18:30.4056 5.3 64.8 0.1 Fermi-LAT 8 256 47-291 Mo, K, R, IA, Me, W, L, ARR bn110430375 GRB 110430A 09:00:13.4027 147.1 67.9 2.5 Fermi-GBM 14 2048 47-291 K, W bn110503145 GRB 110503B 03:28:26.1217 70.5 -10.9 4.3 Fermi-GBM 11 512 47-291 K, IA bn110505203 GRB 110505A 04:52:56.4318 16.8 -32.3 3.1 Fermi-GBM 9 256 47-291 K, S bn110509142 GRB 110509A 03:24:38.7932 180.8 -34.0 4.6 Fermi-GBM 17 4096 47-291 K, IA, S, W bn110509475 GRB 110509B 11:24:15.5795 74.7 -27.0 8.3 Fermi-GBM 5 64 47-291 IA bn110511616 GRB 110511A 14:47:12.6955 214.1 -45.4 10.6 Fermi-GBM 15 2048 47-291 bn110517453 GRB 110517A 10:52:35.4094 296.1 -73.8 9.0 Fermi-GBM 5 64 47-291 IA

– 72 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn110517573 GRB 110517A 13:44:47.6003 190.1 6.3 2.1 Fermi-GBM 11 512 47-291 Mo, K, IA, W bn110517902 GRB 110517B 21:38:48.2981 85.6 47.3 8.3 Fermi-GBM 6 128 47-291 IA bn110520302 GRB 110520B 07:14:26.2366 71.0 -85.9 12.4 Fermi-GBM 14 2048 47-291 bn110521478 GRB 110521B 11:28:58.8830 57.5 -62.3 1.3 Fermi-GBM 4 64 47-291 K, R, IA, Me bn110522256 GRB 110522A 06:08:17.4489 228.9 55.5 5.6 Fermi-GBM 16 4096 47-291 K, IA, S bn110522296 GRB 110522B 07:06:01.9310 184.5 49.3 6.4 Fermi-GBM 13 1024 47-291 IA, W bn110522633 GRB 110522C 15:11:56.6064 180.6 -26.8 12.5 Fermi-GBM 6 128 47-291 Mo, K, IA, S, W bn110523344 GRB 110523A 08:15:54.5808 219.0 -15.4 4.5 Fermi-GBM 8 256 47-291 R, IA bn110526715 GRB 110526A 17:09:01.8091 102.5 -16.4 5.8 Fermi-GBM 4 64 47-291 K, IA bn110528624 GRB 110528A 14:58:44.3001 44.8 -6.9 2.5 Fermi-GBM 15 2048 47-291 IA, W bn110529034 GRB 110529A 00:48:42.8715 118.3 67.9 1.5 Fermi-GBM 5 64 47-291 K, R, S, W, L, ARR bn110529262 GRB 110529B 06:17:41.0141 172.6 8.8 2.1 Fermi-GBM 10 512 47-291 K, IA bn110529811 GRB 110529C 19:27:12.7635 340.6 1.9 4.8 Fermi-GBM 12 1024 47-291 IA, S, W bn110531448 GRB 110531A 10:45:10.5602 190.5 11.9 11.1 Fermi-GBM 14 2048 47-291 bn110601681 GRB 110601A 16:20:16.0763 310.7 11.5 3.0 Fermi-GBM 8 256 47-291 K, IA, S bn110605183 GRB 110605A 04:23:32.3035 14.9 52.5 1.0 Fermi-GBM 10 512 47-291 Mo, K, IA, W bn110605780 GRB 110605B 18:42:49.0448 242.1 -3.1 10.1 Fermi-GBM 8 256 47-291 IA bn110609185 GRB 110609A 04:26:11.0591 327.8 44.6 12.7 Fermi-GBM 12 1024 47-291 bn110609425 GRB 110609B 10:12:06.1636 317.6 -38.2 4.7 Fermi-GBM 12 1024 47-291 bn110610640 GRB 110610A 15:21:32.5485 308.2 74.8 0.0 Fermi-GBM 13 1024 47-291 K, IA, S, W bn110613631 GRB 110613A 15:08:46.3000 336.9 -3.5 2.8 Fermi-GBM 12 1024 47-291 Mo, IA, Me, W bn110616648 GRB 110616A 15:33:25.2346 274.5 -34.0 12.0 Fermi-GBM 16 4096 47-291 R, IA bn110618366 GRB 110618A 08:47:36.3831 176.8 -71.7 0.7 IPN 14 2048 47-291 Mo, K, IA, S, Me, A bn110618760 GRB 110618B 18:14:16.3073 147.1 -7.5 2.1 Fermi-GBM 17 4096 47-291 K, IA, Me bn110622158 GRB 110622A 03:47:19.1055 134.0 19.5 1.8 Fermi-GBM 17 4096 47-291 Mo, K, IA, S, Me, W bn110624906 GRB 110624A 21:44:25.5647 65.0 -15.9 17.3 Fermi-GBM 14 2048 47-291 S bn110625579 GRB 110625B 13:53:24.5753 315.3 -39.4 4.6 Fermi-GBM 13 1024 47-291 K, IA, W bn110625881 GRB 110625A 21:08:18.2358 286.7 6.8 0.0 Swift 10 512 47-291 K, IA, S, Me, W, L, ARR bn110626448 GRB 110626A 10:44:54.2131 131.9 5.6 7.7 Fermi-GBM 8 256 47-291 K, IA, W bn110629174 GRB 110629A 04:09:58.1975 69.4 25.0 4.8 Fermi-GBM 10 512 47-291 K, IA, Me

– 73 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn110702187 GRB 110702A 04:29:28.9167 5.6 -37.7 4.8 Fermi-GBM 10 512 47-291 K, IA, S, W bn110703557 GRB 110703A 13:22:15.5813 155.4 -29.3 3.8 Fermi-GBM 9 256 47-291 IA bn110705151 GRB 110705A 03:37:11.9380 156.0 40.1 0.2 IPN 1 16 47-291 Mo, K, R, IA, S, Me, W bn110705364 GRB 110705B 08:43:43.4178 123.0 28.8 3.1 Fermi-GBM 14 2048 47-291 Mo, K, R, IA, S, Me, W bn110706202 GRB 110706A 04:51:04.0288 100.1 6.1 8.0 Fermi-GBM 15 2048 47-291 Mo, K, R, IA, Me, W bn110706477 GRB 110706B 11:26:15.7565 94.2 -50.8 2.0 Fermi-GBM 12 1024 47-291 IA, Me bn110706728 GRB 110706C 17:27:56.3453 9.1 31.7 4.1 Fermi-GBM 5 64 47-291 Mo, K, IA, S bn110706977 GRB 110706D 23:26:51.4124 347.5 7.1 2.6 Fermi-GBM 9 256 47-291 K, S bn110709463 GRB 110709C 11:06:53.3660 155.4 23.1 1.5 Fermi-GBM 8 256 47-291 K, IA, Me bn110709642 GRB 110709A 15:24:27.3676 238.9 40.9 0.0 Swift 14 2048 47-291 Mo, K, R, IA, S, Me, W, L, ARR bn110709862 GRB 110709D 20:40:50.0855 156.2 -41.8 10.8 Fermi-GBM 10 512 47-291 W bn110710954 GRB 110710A 22:53:50.5974 229.1 48.4 3.9 Fermi-GBM 4 64 47-291 K, R, IA, W bn110716018 GRB 110716A 00:25:19.9720 329.7 -77.0 3.9 Fermi-GBM 8 256 47-291 bn110717180 GRB 110717A 04:19:50.6602 308.5 -7.8 7.4 Fermi-GBM 1 16 47-291 K, IA bn110717319 GRB 110717B 07:39:55.8621 312.8 -14.8 1.2 Fermi-GBM 16 4096 47-291 Mo, K, IA, Me bn110720177 GRB 110720A 04:14:32.3820 198.6 -44.3 2.6 Fermi-GBM 9 256 47-291 Mo, K, R, IA, Me bn110721200 GRB 110721A 04:47:43.7605 332.5 -38.6 0.4 IPN 4 64 47-291 K, IA, Me, A, L, ARR bn110722694 GRB 110722A 16:39:16.6757 215.1 5.0 2.0 Fermi-GBM 17 4096 47-291 Mo, IA, S, Me bn110722710 GRB 110722B 17:01:45.9135 8.3 62.7 4.7 Fermi-GBM 17 4096 47-291 Mo, K, IA bn110725236 GRB 110725A 05:39:42.0592 270.1 -25.2 9.1 Fermi-GBM 5 64 47-291 K, IA bn110726211 GRB 110726B 05:03:59.4873 317.7 2.5 3.8 Fermi-GBM 17 4096 47-291 K, IA, Me bn110728056 GRB 110728A 01:20:22.8161 166.6 20.1 2.6 Fermi-GBM 7 128 47-291 IA, Me, W bn110729142 GRB 110729A 03:25:05.9291 353.4 5.0 1.4 Fermi-GBM 12 1024 47-291 K, R, IA, S, Me bn110730008 GRB 110730A 00:11:54.7434 263.1 -22.8 4.3 Fermi-GBM 17 4096 47-291 bn110730660 GRB 110730B 15:50:43.7622 335.1 -2.9 3.8 Fermi-GBM 15 2048 47-291 Mo, R, IA, S bn110731465 GRB 110731A 11:09:29.9540 280.5 -28.5 0.0 Swift 9 256 47-291 K, R, IA, S, Me, W, L, ARR bn110801335 GRB 110801B 08:01:43.0855 248.3 -57.1 7.3 Fermi-GBM 5 64 47-291 IA bn110803783 GRB 110803A 18:47:25.4281 300.4 -11.4 7.5 Fermi-GBM 12 1024 47-291 IA bn110806934 GRB 110806A 22:25:31.1146 112.0 2.4 2.4 Fermi-GBM 15 2048 47-291 K, IA, S, W bn110809461 GRB 110809A 11:03:34.0044 172.2 -13.9 1.8 Fermi-GBM 14 2048 47-291 IA

– 74 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn110812899 GRB 110812B 21:35:08.6065 77.8 1.7 2.5 Fermi-GBM 8 256 47-291 bn110813237 GRB 110813A 05:40:50.9313 61.2 34.6 1.0 Fermi-GBM 12 1024 47-291 Mo, K, R, Me bn110817191 GRB 110817A 04:35:12.1202 336.0 -45.8 1.5 Fermi-GBM 7 128 47-291 Mo, K, R, IA, S, Me, W, ARR bn110818860 GRB 110818A 20:37:54.2210 317.3 -64.0 0.0 Swift 16 4096 47-291 IA, S bn110819665 GRB 110819A 15:57:54.9716 139.5 -76.6 3.2 Fermi-GBM 4 64 47-291 K, IA, S, Me, W bn110820476 GRB 110820C 11:25:44.3476 90.5 21.6 4.0 Fermi-GBM 13 1024 47-291 W bn110824009 GRB 110824A 00:13:09.9413 152.1 1.3 1.7 Fermi-GBM 4 64 47-291 Mo, K, IA, S, Me, W, A bn110825102 GRB 110825A 02:26:50.9376 44.9 15.4 0.1 IPN 25 64 23-47 Mo, R, IA, S, Me, W, A, ARR bn110825265 GRB 110825B 06:22:11.4387 251.3 -80.3 5.2 Fermi-GBM 17 4096 47-291 bn110828575 GRB 110828A 13:48:14.7196 110.6 -23.8 1.0 Fermi-LAT 12 1024 47-291 K, IA, S, Me, W bn110831282 GRB 110831A 06:45:26.6063 352.4 33.7 5.9 Fermi-GBM 10 512 47-291 K, IA, Me, W bn110901230 GRB 110901A 05:31:44.0575 141.3 -15.8 3.4 Fermi-GBM 16 4096 47-291 bn110903009 GRB 110903B 00:13:06.2933 164.2 42.1 1.2 Fermi-GBM 8 256 47-291 K, IA, S, Me, W bn110903111 GRB 110903A 02:39:34.4223 197.1 59.0 0.0 INTEGRAL 8 256 47-291 K, IA, IS, S, Me, W bn110904124 GRB 110904A 02:58:15.9607 359.7 35.9 2.6 Fermi-GBM 9 256 47-291 K, R, IA, Me, W bn110904163 GRB 110904B 03:54:36.0195 190.4 -28.9 6.1 Fermi-GBM 11 512 47-291 IA, S bn110904531 GRB 110904C 12:44:19.3299 323.7 23.9 1.7 Fermi-GBM 14 2048 47-291 K, IA, S bn110906302 GRB 110906B 07:15:13.4195 26.3 17.6 4.0 Fermi-GBM 8 256 47-291 IA, Me bn110909116 GRB 110909A 02:46:58.1898 347.3 -24.2 2.0 Fermi-GBM 8 256 47-291 Mo, K, IA, Me bn110911071 GRB 110911A 01:41:41.5686 258.6 -67.0 50.0 Fermi-GBM 11 512 47-291 bn110916016 GRB 110916A 00:23:01.6483 4.1 40.4 21.9 Fermi-GBM 11 512 47-291 IA bn110919634 GRB 110919A 15:12:15.7838 280.0 66.4 1.0 Fermi-GBM 17 4096 47-291 Mo, K, S, Me, W bn110920338 GRB 110920A 08:07:16.4098 87.6 38.8 5.0 Fermi-GBM 9 256 47-291 Mo, K, R, IA, S, Me, W bn110920546 GRB 110920A 13:05:43.8122 209.8 -27.6 1.0 Fermi-GBM 10 512 47-291 K, R, IA, Me, W bn110921444 GRB 110921C 10:38:48.2023 6.1 -5.8 7.3 Fermi-GBM 13 1024 47-291 IA bn110921577 GRB 110921A 13:51:22.5714 294.1 36.4 0.1 Swift 13 1024 47-291 K, IA, S, W bn110921912 GRB 110921B 21:52:45.0919 18.0 -27.8 1.0 Fermi-GBM 8 256 47-291 Mo, K, IA, S, Me, ARR bn110923835 GRB 110923A 20:01:58.1336 323.4 -10.9 3.7 Fermi-GBM 9 256 47-291 Mo, IA bn110926107 GRB 110926A 02:33:36.6438 69.4 10.4 3.3 Fermi-GBM 14 2048 47-291 Mo, IA, Me bn110928180 GRB 110928B 04:19:51.4104 153.4 34.3 1.4 Fermi-GBM 15 2048 47-291 Mo, K, R, IA, Me, W

– 75 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn110929187 GRB 110929A 04:28:53.5846 288.2 -62.2 4.0 Fermi-GBM 4 64 47-291 K, R, IA, S bn110930564 GRB 110930A 13:32:31.1890 187.3 -53.7 5.1 Fermi-GBM 14 2048 47-291 IA bn111001804 GRB 111001A 19:17:58.5757 340.0 -15.3 15.1 Fermi-GBM 6 128 47-291 IA bn111003465 GRB 111003A 11:10:00.2298 276.8 -62.3 1.1 Fermi-GBM 8 256 47-291 Mo, K, R, IA, S, Me, W, ARR bn111005398 GRB 111005B 09:33:03.3758 340.3 75.8 5.3 Fermi-GBM 17 4096 47-291 K, IA bn111008992 GRB 111008B 23:49:01.2916 220.8 -5.7 4.3 Fermi-GBM 14 2048 47-291 bn111009282 GRB 111009A 06:45:40.1731 183.0 -56.8 1.1 Fermi-GBM 10 512 47-291 K, IA, S, Me bn111010237 GRB 111010A 05:40:34.5636 87.1 44.0 3.2 Fermi-GBM 16 4096 47-291 K, IA bn111010660 GRB 111010B 15:50:21.7971 183.5 -31.7 7.1 Fermi-GBM 8 256 47-291 bn111010709 GRB 111010C 17:00:35.2884 69.8 41.9 1.7 Fermi-GBM 14 2048 47-291 K, R bn111010899 GRB 111010D 21:34:13.6769 77.0 -15.0 7.7 Fermi-GBM 12 1024 47-291 bn111011094 GRB 111011A 02:15:09.8948 38.0 -12.5 6.8 Fermi-GBM 3 32 47-291 K, IA, W bn111012456 GRB 111012A 10:56:37.4423 154.0 68.1 2.1 Fermi-GBM 12 1024 47-291 K, IA, Me, A bn111012811 GRB 111012B 19:27:39.0980 97.2 67.1 1.7 Fermi-GBM 4 64 47-291 Mo, K, IA, S, Me, W bn111015427 GRB 111015A 10:15:12.9852 220.6 -58.4 2.0 Fermi-GBM 9 256 47-291 Mo, K, R, IA, S, Me bn111017657 GRB 111017A 15:45:23.7190 8.1 -7.0 1.0 Fermi-GBM 13 1024 47-291 K, R, IA, Me, W, ARR bn111018595 GRB 111018B 14:16:48.8680 106.1 66.1 7.2 Fermi-GBM 9 256 47-291 K, IA bn111018785 GRB 111018C 18:50:14.7095 124.2 81.3 7.5 Fermi-GBM 14 2048 47-291 Mo, W bn111022854 GRB 111022C 20:29:23.7041 104.5 -33.1 9.3 Fermi-GBM 5 64 47-291 W bn111024722 GRB 111024B 17:19:02.8789 162.7 -44.9 2.6 Fermi-GBM 10 512 47-291 K, R, IA, S, Me, W bn111024896 GRB 111024C 21:30:02.2436 91.2 -1.8 13.1 Fermi-GBM 5 64 47-291 IA bn111025078 GRB 111025A 01:52:45.7422 325.6 -35.5 2.7 Fermi-GBM 13 1024 47-291 K, IA, S bn111103441 GRB 111103A 10:35:13.3905 327.1 -10.5 0.0 Swift 9 256 47-291 K, S, W bn111103948 GRB 111103C 22:45:05.7206 201.6 -43.2 11.0 Fermi-GBM 3 32 47-291 IA, W bn111105457 GRB 111105A 10:57:36.0828 153.5 7.3 14.2 Fermi-GBM 11 512 47-291 W bn111107035 GRB 111107A 00:50:25.4844 129.5 -66.5 0.0 Swift 15 2048 47-291 S bn111107076 GRB 111107B 01:49:46.0210 315.5 -38.5 3.5 Fermi-GBM 13 1024 47-291 K, R, IA, Me, W bn111109453 GRB 111109B 10:52:32.2473 133.7 -33.4 7.4 Fermi-GBM 12 1024 47-291 K, Me bn111109873 GRB 111109C 20:57:16.6575 130.0 44.7 1.5 Fermi-GBM 11 512 47-291 Mo, K, IA bn111112908 GRB 111112A 21:47:48.1637 223.7 28.8 3.8 Fermi-GBM 1 16 47-291 K, IA, Me, W

– 76 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn111113410 GRB 111113B 09:50:11.7591 4.3 -7.5 4.0 Fermi-GBM 12 1024 47-291 IA bn111114233 GRB 111114A 05:35:45.3513 268.1 -20.0 5.7 Fermi-GBM 13 1024 47-291 IA, Me, W bn111117510 GRB 111117A 12:13:42.0293 12.7 23.0 0.0 Swift 3 32 47-291 IA, S, ARR bn111117526 GRB 111117B 12:38:00.7586 27.2 -16.1 6.2 Fermi-GBM 12 1024 47-291 IA, S, W bn111120556 GRB 111120A 13:20:24.0486 344.6 -37.3 5.2 Fermi-GBM 17 4096 47-291 bn111124308 GRB 111124A 07:24:10.0859 94.1 4.6 9.4 Fermi-GBM 13 1024 47-291 IA bn111127810 GRB 111127A 19:27:01.6976 103.7 3.5 2.1 Fermi-GBM 13 1024 47-291 Mo, K, S, Me, W bn111201599 GRB 111201A 14:22:45.2597 185.5 28.6 8.6 Fermi-GBM 15 2048 47-291 S bn111203054 GRB 111203A 01:17:04.0335 53.2 33.5 3.2 Fermi-GBM 17 4096 47-291 S, W bn111203609 GRB 111203B 14:36:45.3790 242.8 -22.1 13.3 Fermi-GBM 17 4096 47-291 bn111207512 GRB 111207B 12:17:16.2045 164.9 -17.9 10.0 Fermi-GBM 12 1024 47-291 bn111208353 GRB 111208A 08:28:10.7888 316.5 51.8 4.5 Fermi-GBM 14 2048 47-291 K, IA, S, W bn111216389 GRB 111216A 09:20:31.5096 186.0 5.8 1.4 Fermi-GBM 13 1024 47-291 K, R, IA, Me bn111220486 GRB 111220A 11:40:26.2423 267.6 -56.0 1.4 Fermi-GBM 14 2048 47-291 Mo, K, R, IA, Me bn111221739 GRB 111221A 17:43:30.8060 10.2 -29.8 1.9 Fermi-GBM 5 64 47-291 Mo, K, R, IA, S, W, A bn111222619 GRB 111222A 14:51:55.0233 179.2 69.0 0.5 IPN 1 16 47-291 Mo, K, IA, S, Me, W, ARR bn111226795 GRB 111226A 19:04:58.2845 21.5 3.9 1.0 Fermi-GBM 15 2048 47-291 K, IA bn111228453 GRB 111228B 10:52:50.5202 330.6 14.5 3.6 Fermi-GBM 26 64 23-47 K, A bn111228657 GRB 111228A 15:45:30.8028 150.1 18.3 0.0 Swift 8 256 47-291 K, IA, S, Me, W bn111230683 GRB 111230A 16:23:08.6037 150.2 33.4 2.8 Fermi-GBM 14 2048 47-291 Mo, K, IA, Me bn111230819 GRB 111230B 19:39:32.1420 242.6 -22.1 2.0 Fermi-GBM 9 256 47-291 Mo, K, IA, S, Me bn120101354 GRB 120101A 08:30:06.9076 185.9 52.9 8.8 Fermi-GBM 5 64 47-291 IA, S bn120102095 GRB 120102A 02:16:23.2391 276.2 24.7 0.0 Swift 10 512 47-291 K, R, IA, S, Me bn120102416 GRB 120102B 09:59:01.2725 341.1 -23.2 3.6 Fermi-GBM 11 512 47-291 bn120105584 GRB 120105A 14:00:35.9014 203.7 40.1 2.8 Fermi-GBM 16 4096 47-291 Mo bn120107384 GRB 120107A 09:12:15.4107 246.4 -69.9 0.5 Fermi-LAT 4 64 47-291 Mo, K, Me, W, L bn120109824 GRB 120109A 19:46:01.9417 251.3 30.8 11.3 Fermi-GBM 15 2048 47-291 bn120111051 GRB 120111A 01:13:27.6277 95.3 5.0 5.4 Fermi-GBM 17 4096 47-291 R, IA bn120114433 GRB 120114B 10:23:39.2149 263.2 -75.6 11.1 Fermi-GBM 6 128 47-291 S bn120114681 GRB 120114A 16:20:05.6800 317.9 57.0 0.0 Swift 17 4096 47-291 K, IA, S, Me, W

– 77 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn120118709 GRB 120118B 17:00:22.9435 124.9 -7.2 0.1 Swift 14 2048 47-291 S bn120118898 GRB 120118C 21:32:45.8056 166.6 47.9 7.2 Fermi-GBM 4 64 47-291 K, IA, Me bn120119170 GRB 120119A 04:04:25.0642 120.0 -9.8 0.0 Swift 10 512 47-291 K, IA, S, Me bn120119229 GRB 120119B 05:29:49.0086 139.6 -61.3 2.0 Fermi-GBM 5 64 47-291 Mo, K, IA, S, Me, W bn120119354 GRB 120119C 08:29:29.8163 66.0 -33.9 4.4 Fermi-GBM 11 512 47-291 IA, S bn120120432 GRB 120120A 10:21:25.4149 134.7 35.5 5.7 Fermi-GBM 15 2048 47-291 K bn120121101 GRB 120121B 02:25:53.7993 235.7 -39.3 7.9 Fermi-GBM 17 4096 47-291 IA bn120121251 GRB 120121C 06:00:45.2360 208.9 -1.3 1.6 Fermi-GBM 13 1024 47-291 K, IA, S bn120122300 GRB 120122A 07:12:06.0365 96.6 16.5 2.7 Fermi-GBM 9 256 47-291 Mo, IA, S, W bn120129312 GRB 120129B 07:29:14.0537 26.5 -8.5 15.0 IPN 10 512 47-291 bn120129580 GRB 120129A 13:55:46.2445 30.4 59.3 0.9 IPN 4 64 47-291 K, S, Me, A bn120130699 GRB 120130A 16:47:10.8812 150.0 -17.5 3.7 Fermi-GBM 9 256 47-291 K, IA, S bn120130906 GRB 120130B 21:44:54.3314 65.0 9.5 5.6 Fermi-GBM 12 1024 47-291 bn120130938 GRB 120130C 22:30:34.4655 323.3 58.6 1.0 Fermi-GBM 16 4096 47-291 K, IA bn120203812 GRB 120203A 19:29:23.9764 339.3 -46.6 6.8 Fermi-GBM 14 2048 47-291 IA, S, W bn120204054 GRB 120204A 01:17:07.8322 292.6 -3.6 1.0 Fermi-GBM 15 2048 47-291 Mo, K, IA, S, Me, W, ARR bn120205285 GRB 120205A 06:51:05.3074 243.4 25.9 23.8 Fermi-GBM 10 512 47-291 bn120206949 GRB 120206A 22:46:16.6847 73.4 58.4 2.2 Fermi-GBM 10 512 47-291 Mo, K, IA, S, Me, W bn120210650 GRB 120210A 15:35:43.2811 54.7 -58.5 5.5 Fermi-GBM 5 64 47-291 IA, W bn120212353 GRB 120212B 08:27:47.5895 303.4 -48.1 7.5 Fermi-GBM 5 64 47-291 bn120212383 GRB 120212A 09:11:23.4980 43.1 -18.0 0.1 Swift 12 1024 47-291 IA, S, W bn120213606 GRB 120213B 14:32:44.6094 183.5 5.8 4.2 Fermi-GBM 10 512 47-291 K, IA, W bn120217808 GRB 120217A 19:23:50.5717 122.4 36.8 3.2 Fermi-GBM 6 128 47-291 K, IA, Me, W bn120217904 GRB 120217B 21:41:57.7681 298.7 32.7 1.5 Fermi-GBM 5 64 47-291 Mo, K, IA, S, Me bn120218276 GRB 120218B 06:37:02.3707 101.8 -1.4 3.6 Fermi-GBM 17 4096 47-291 IA bn120219563 GRB 120219B 13:31:23.1100 274.9 -31.1 10.9 Fermi-GBM 9 256 47-291 W bn120220210 GRB 120220A 05:02:21.6029 206.1 -57.4 7.4 Fermi-GBM 15 2048 47-291 IA bn120222021 GRB 120222A 00:29:36.1300 299.5 26.5 2.8 Fermi-GBM 5 64 47-291 Mo, K, S, Me, W bn120222119 GRB 120222A 02:51:54.0863 340.0 -36.4 5.7 Fermi-GBM 17 4096 47-291 bn120223933 GRB 120223A 22:23:48.9431 219.6 -7.5 2.7 Fermi-GBM 6 128 47-291 K, R, IA, Me, W

– 78 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn120224282 GRB 120224B 06:46:28.5226 118.4 41.3 4.6 Fermi-GBM 16 4096 47-291 K, IA, S, W bn120224898 GRB 120224C 21:33:07.3852 331.1 10.2 3.6 Fermi-GBM 15 2048 47-291 Mo, K, IA, S bn120226447 GRB 120226B 10:44:16.3850 87.6 52.3 1.1 Fermi-GBM 7 128 47-291 Mo, K, IA, Me, W bn120226871 GRB 120226A 20:54:17.0267 302.9 48.7 6.0 IPN 17 4096 47-291 Mo, K, R, IA, S, Me, W, L, ARR bn120227391 GRB 120227A 09:22:45.9705 84.8 8.5 6.3 Fermi-GBM 16 4096 47-291 Mo, K, IA, Me bn120227725 GRB 120227B 17:24:41.0543 256.7 -88.9 1.2 Fermi-GBM 13 1024 47-291 Mo, K, IA, S, Me, W bn120302080 GRB 120302A 01:55:34.0020 122.5 29.7 0.0 Swift 10 512 47-291 S, W bn120302722 GRB 120302B 17:19:59.0822 24.1 9.7 13.9 Fermi-GBM 4 64 47-291 bn120304061 GRB 120304A 01:27:48.7178 127.2 -61.1 1.0 Fermi-GBM 8 256 47-291 K, R, IA, W bn120304248 GRB 120304B 05:57:47.7804 277.3 -46.2 1.0 Fermi-GBM 1 16 47-291 Mo, K, R, IA, Me, W bn120308588 GRB 120308B 14:06:05.7733 30.8 55.2 1.2 Fermi-GBM 4 64 47-291 R, W bn120312671 GRB 120312A 16:06:29.6672 251.8 23.9 0.0 Swift 15 2048 47-291 R, IA, S bn120314412 GRB 120314A 09:52:34.6735 17.9 -48.7 17.8 Fermi-GBM 8 256 47-291 bn120316008 GRB 120316A 00:11:02.5595 57.0 -56.3 0.6 IPN 17 4096 47-291 Mo, K, R, IA, S, W, L bn120319983 GRB 120319A 23:35:04.2132 69.8 -45.4 3.7 Fermi-GBM 16 4096 47-291 W bn120323162 GRB 120323B 03:52:49.2705 211.1 -45.2 3.8 Fermi-GBM 7 128 47-291 Mo, K, S, Me, W bn120323507 GRB 120323A 12:10:19.7231 340.4 29.7 0.2 IPN 1 16 47-291 K, IA, S, Me, L, ARR bn120326056 GRB 120326A 01:20:31.5128 273.9 69.3 0.0 Swift 10 512 47-291 K, R, S, W bn120327418 GRB 120327B 10:01:49.2336 170.4 23.8 13.0 Fermi-GBM 7 128 47-291 IA bn120328268 GRB 120328B 06:26:20.9532 228.1 22.8 1.0 Fermi-GBM 10 512 47-291 K, IA, S, Me, A, L bn120331055 GRB 120331A 01:19:06.6440 26.4 -54.8 6.5 Fermi-GBM 1 16 47-291 Mo, IA, W, A bn120402669 GRB 120402B 16:04:00.7578 223.7 -10.4 2.6 Fermi-GBM 26 64 23-47 K, IA bn120403857 GRB 120403B 20:33:58.4931 55.3 -89.0 0.0 Swift 13 1024 47-291 bn120410585 GRB 120410A 14:02:00.1923 159.6 -17.0 8.6 Fermi-GBM 2 32 47-291 IA, S, W bn120411925 GRB 120411A 22:12:25.6497 38.1 -7.2 8.4 Fermi-GBM 9 256 47-291 Mo, IA, S bn120412055 GRB 120412A 01:18:42.1478 29.4 -24.7 13.5 Fermi-GBM 13 1024 47-291 bn120412920 GRB 120412B 22:04:40.5637 38.9 7.1 2.8 Fermi-GBM 9 256 47-291 K bn120415076 GRB 120415A 01:49:57.6821 213.5 16.7 4.4 Fermi-GBM 11 512 47-291 K, R, IA, Me bn120415891 GRB 120415B 21:23:41.0262 190.7 4.9 6.9 Fermi-GBM 4 64 47-291 IA, S bn120415958 GRB 120415C 22:59:19.1333 150.5 61.3 5.0 Fermi-GBM 17 4096 47-291 K, R

– 79 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn120420249 GRB 120420A 05:58:07.2575 47.9 -52.2 5.4 Fermi-GBM 11 512 47-291 K, W bn120420858 GRB 120420B 20:35:13.0705 109.3 10.8 1.1 Fermi-GBM 11 512 47-291 K, IA, W bn120426090 GRB 120426A 02:09:14.3305 111.5 -65.6 0.4 IPN 5 64 47-291 Mo, K, IA, S, Me, ARR bn120426585 GRB 120426B 14:02:22.3555 285.5 -13.7 3.8 Fermi-GBM 10 512 47-291 K, IA, S bn120427054 GRB 120427A 01:17:27.7906 224.9 29.3 0.3 IPN 8 256 47-291 Mo, K, R, IA, Me, W bn120427153 GRB 120427B 03:40:37.8678 114.7 50.2 26.6 Fermi-LAT 17 4096 47-291 IA bn120429003 GRB 120429A 00:04:07.2639 166.0 -8.8 15.4 Fermi-GBM 8 256 47-291 bn120429484 GRB 120429B 11:37:03.7360 133.0 -32.2 5.3 Fermi-GBM 10 512 47-291 IA bn120430980 GRB 120430A 23:30:43.3489 47.2 18.5 5.8 Fermi-GBM 14 2048 47-291 W bn120504468 GRB 120504A 11:13:39.9348 329.9 46.8 4.1 Fermi-GBM 14 2048 47-291 bn120504945 GRB 120504B 22:40:08.6011 200.3 -24.2 6.7 Fermi-GBM 11 512 47-291 IA, S bn120506128 GRB 120506A 03:05:02.1148 172.2 -33.7 9.3 Fermi-GBM 10 512 47-291 bn120509619 GRB 120509A 14:52:02.8400 195.4 38.3 16.8 Fermi-GBM 7 128 47-291 IA bn120510900 GRB 120510B 21:36:26.0997 186.9 -55.2 3.8 Fermi-GBM 16 4096 47-291 R, IA, W bn120511638 GRB 120511A 15:18:47.9162 226.9 -60.5 2.1 Fermi-GBM 9 256 47-291 K, IA, S, Me, W bn120512112 GRB 120512A 02:41:44.3342 325.6 13.6 0.0 INTEGRAL 12 1024 47-291 Mo, K, R, IA, IS, S, Me, W bn120513531 GRB 120513A 12:44:00.4653 140.8 75.0 10.8 Fermi-LAT 11 512 47-291 bn120519721 GRB 120519A 17:18:14.9703 180.2 20.5 2.7 Fermi-GBM 4 64 47-291 Mo, K, IA, S, Me, W, A bn120520949 GRB 120520A 22:46:24.6629 45.9 35.3 8.3 Fermi-GBM 8 256 47-291 S, W bn120521380 GRB 120521B 09:07:52.3858 197.0 -52.7 0.0 Swift 15 2048 47-291 K, IA, S bn120522361 GRB 120522B 08:39:16.8386 56.1 54.8 2.0 Fermi-GBM 13 1024 47-291 K, IA, S, Me, W bn120524134 GRB 120524A 03:12:54.6787 358.1 -15.6 10.4 Fermi-GBM 4 64 47-291 bn120526303 GRB 120526A 07:16:40.7695 66.3 -32.2 1.0 Fermi-GBM 15 2048 47-291 Mo, K, R, IA, S, W bn120528442 GRB 120528A 10:36:00.2173 295.1 6.5 6.0 Fermi-GBM 10 512 47-291 K, IA, S, W bn120530121 GRB 120530A 02:53:41.8622 176.0 78.8 3.3 Fermi-GBM 6 128 47-291 K, IA, S, Me, W bn120531393 GRB 120531A 09:26:38.3653 290.4 1.2 11.0 Fermi-GBM 14 2048 47-291 bn120603439 GRB 120603A 10:32:09.8539 198.8 4.3 0.5 IPN 5 64 47-291 K, R, IA, Me, W bn120604220 GRB 120604A 05:16:31.3117 163.9 -7.4 9.3 Fermi-GBM 4 64 47-291 bn120604343 GRB 120604B 08:13:40.1576 113.6 -2.8 11.9 Fermi-GBM 16 4096 47-291 R, S, W bn120605453 GRB 120605A 10:52:15.9037 243.6 41.5 2.6 Fermi-GBM 9 256 47-291 Mo, K, IA, S, Me

– 80 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn120608489 GRB 120608A 11:43:51.8312 230.0 -26.1 2.5 Fermi-GBM 5 64 47-291 IA, S bn120608777 GRB 120608B 18:38:33.0354 313.3 12.6 5.1 Fermi-GBM 12 1024 47-291 S, W bn120609580 GRB 120609A 13:54:35.6228 67.3 13.0 7.5 Fermi-GBM 9 256 47-291 bn120611108 GRB 120611A 02:36:00.5206 324.7 -44.8 5.3 Fermi-GBM 13 1024 47-291 bn120612680 GRB 120612B 16:19:45.5477 211.9 34.6 7.1 Fermi-GBM 17 4096 47-291 bn120612687 GRB 120612C 16:29:44.5573 39.7 -37.9 10.6 Fermi-GBM 4 64 47-291 K, IA, W bn120616630 GRB 120616A 15:06:50.6386 79.7 56.4 8.5 Fermi-GBM 3 32 47-291 IA bn120618128 GRB 120618A 03:03:49.8754 77.3 75.8 2.6 Fermi-GBM 9 256 47-291 K, R, IA, S, Me, W bn120618919 GRB 120618B 22:03:34.3126 213.6 -2.1 4.8 Fermi-GBM 7 128 47-291 K, IA, Me, W bn120619884 GRB 120619A 21:13:16.9128 190.7 -25.0 2.8 Fermi-GBM 7 128 47-291 IA, W bn120624309 GRB 120624A 07:24:25.3393 4.8 7.2 0.4 IPN 4 64 47-291 K, IA, S, Me bn120624933 GRB 120624B 22:23:54.9339 172.9 6.5 1.0 Fermi-GBM 14 2048 47-291 ARR bn120625119 GRB 120625A 02:50:46.0374 51.3 51.1 1.2 Fermi-GBM 12 1024 47-291 K, R, IA, S, Me, W bn120629565 GRB 120629A 13:34:11.6814 176.2 -0.6 8.9 Fermi-GBM 8 256 47-291 R bn120701654 GRB 120701B 15:41:48.3152 182.7 -45.7 14.8 Fermi-GBM 6 128 47-291 IA, Me bn120702891 GRB 120702A 21:23:19.1712 227.8 36.8 8.5 Fermi-GBM 11 512 47-291 S bn120703417 GRB 120703B 10:01:11.6882 69.5 34.7 2.6 Fermi-GBM 12 1024 47-291 K, R, IA, Me bn120703498 GRB 120703C 11:56:56.8702 210.5 46.3 5.2 Fermi-GBM 13 1024 47-291 bn120703726 GRB 120703A 17:25:17.0323 339.4 -29.7 0.0 Swift 14 2048 47-291 K, R, IA, S, Me, ARR bn120707800 GRB 120707A 19:12:17.4295 291.1 -34.4 1.0 Fermi-GBM 16 4096 47-291 Mo, K, R, IA, S, W, ARR bn120709883 GRB 120709A 21:11:40.3666 318.4 -50.1 0.5 Fermi-LAT 4 64 47-291 K, IA, Me, L bn120710100 GRB 120710A 02:23:17.0507 120.4 -31.1 4.8 Fermi-GBM 9 256 47-291 S, Me, W bn120711115 GRB 120711A 02:44:53.2943 94.7 -71.0 0.0 INTEGRAL 8 256 47-291 K, R, IA, IS, S, Me, M, L, ARR bn120711446 GRB 120711C 10:42:54.5709 127.9 -31.8 11.0 Fermi-GBM 13 1024 47-291 IA, W bn120712571 GRB 120712A 13:42:25.6057 169.6 -20.0 0.0 Swift 15 2048 47-291 S bn120713226 · · · 05:25:29.1390 161.7 40.7 16.7 Fermi-GBM 14 2048 47-291 bn120715066 · · · 01:35:15.5728 272.1 58.8 3.7 Fermi-GBM 8 256 47-291 bn120716577 · · · 13:51:02.1335 304.5 59.4 5.1 Fermi-GBM 17 4096 47-291 bn120716712 GRB 120716A 17:05:03.9078 313.1 9.6 0.0 Swift 5 64 47-291 IP, K, S bn120719146 · · · 03:30:00.8212 204.3 -43.5 1.4 Fermi-GBM 8 256 47-291

– 81 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn120727354 · · · 08:29:39.0809 163.3 25.1 15.3 Fermi-GBM 13 1024 47-291 bn120727681 · · · 16:20:19.5291 37.8 16.4 1.0 Fermi-GBM 5 64 47-291 bn120728434 GRB 120728B 10:25:24.2360 103.8 -45.9 0.5 IPN 8 256 47-291 IP, K, R, ARR bn120728934 GRB 120728A 22:25:12.7372 137.1 -54.4 0.0 Swift 10 512 47-291 S bn120729456 GRB 120729A 10:56:12.6651 13.1 49.9 0.0 Swift 10 512 47-291 S bn120801920^{aa} · · · 22:05:21.1906 245.7 -47.4 2.4 Fermi-GBM 13 1024 47-291 bn120805706 · · · 16:56:21.7198 30.1 -21.5 10.1 Fermi-GBM 12 1024 47-291 bn120806007 · · · 00:10:08.8657 309.0 6.3 4.2 Fermi-GBM 11 512 47-291 bn120811014 GRB 120811B 00:20:30.2878 43.7 -31.7 1.4 IPN 5 64 47-291 IP, K, S bn120811649 GRB 120811C 15:34:55.0918 199.7 62.3 0.1 Fermi-LAT 14 2048 47-291 S bn120814201 · · · 04:49:12.5790 26.2 22.5 3.7 Fermi-GBM 8 256 47-291 bn120814803 · · · 19:16:06.7456 90.6 33.1 10.7 Fermi-GBM 5 64 47-291 bn120817057 · · · 01:22:09.7753 260.0 -9.1 7.1 Fermi-GBM 16 4096 47-291 bn120817168 GRB 120817B 04:02:29.7231 8.3 -26.4 0.1 Swift 1 16 47-291 IP, S, K bn120819048 · · · 01:08:26.7648 171.5 49.4 7.9 Fermi-GBM 13 1024 47-291 bn120820585 · · · 14:02:21.9871 186.6 -12.3 4.8 Fermi-GBM 14 2048 47-291 bn120822628 · · · 15:03:56.3989 181.7 80.6 7.7 Fermi-GBM 9 256 47-291 bn120824594 · · · 14:16:00.7343 70.9 17.6 3.0 Fermi-GBM 17 4096 47-291 bn120827216 · · · 05:10:25.0107 222.7 -71.9 1.7 Fermi-GBM 9 256 47-291 bn120830212 · · · 05:04:52.7442 337.9 -80.0 3.5 Fermi-GBM 13 1024 47-291 bn120830297 GRB 120830A 07:07:03.5332 88.5 -28.7 0.0 Swift 4 64 47-291 L, S, IP, K bn120830702 · · · 16:51:36.6803 110.0 17.5 3.4 Fermi-GBM 12 1024 47-291 bn120831901 · · · 21:37:31.8746 144.0 -16.2 8.5 Fermi-GBM 5 64 47-291 bn120905657 · · · 15:46:21.1660 356.0 17.0 1.8 Fermi-GBM 14 2048 47-291 bn120907017 GRB 120907A 00:24:24.5106 74.7 -9.3 0.0 Swift 12 1024 47-291 S bn120908873 · · · 20:57:30.9543 268.7 -35.8 1.5 Fermi-GBM 7 128 47-291 bn120908938 GRB 120908A 22:31:00.0242 230.6 -25.8 0.5 MAXI 11 512 47-291 M bn120909070 GRB 120909A 01:41:22.3982 275.7 -59.5 0.0 Swift 11 512 47-291 S, M, K bn120911298 GRB 120911A 07:08:33.9876 358.0 63.1 0.0 Swift 10 512 47-291 S bn120913846 GRB 120913A 20:18:22.8873 146.4 27.0 0.1 Swift 13 1024 47-291 S

– 82 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn120913997 GRB 120913B 23:55:58.7700 213.6 -14.5 0.1 Swift 14 2048 47-291 S bn120914144 · · · 03:26:42.1140 267.9 1.8 5.3 Fermi-GBM 9 256 47-291 bn120915000 · · · 00:00:41.6379 209.4 67.3 5.9 Fermi-GBM 5 64 47-291 bn120915474 · · · 11:22:04.2210 283.6 -1.1 6.5 Fermi-GBM 15 2048 47-291 bn120916085 · · · 02:02:15.9053 82.0 -19.2 11.1 Fermi-GBM 9 256 47-291 bn120916173 GRB 120916A 04:08:40.7546 205.8 36.7 0.3 Fermi-LAT 13 1024 47-291 L, K, W, IP bn120919052 · · · 01:14:23.0657 298.0 -38.1 1.6 Fermi-GBM 10 512 47-291 bn120919309 GRB 120919A 07:24:41.9792 214.8 -45.6 0.4 IPN 6 128 47-291 K, IP, ARR bn120919816 · · · 19:35:41.7964 303.5 -66.2 11.9 Fermi-GBM 15 2048 47-291 bn120920003 · · · 00:04:32.7277 27.1 -26.1 7.8 Fermi-GBM 17 4096 47-291 bn120921877 GRB 120921A 21:03:03.7740 96.4 -64.8 3.2 Fermi-GBM 4 64 47-291 bn120922939 GRB 120922A 22:32:09.4743 234.7 -20.2 0.0 Swift 17 4096 47-291 S bn120926335 · · · 08:02:56.5731 318.4 58.4 1.5 Fermi-GBM 9 256 47-291 bn120926426 · · · 10:13:16.0426 59.7 -37.2 3.8 Fermi-GBM 10 512 47-291 bn120926753 · · · 18:04:35.0992 24.6 -45.6 21.3 Fermi-GBM 14 2048 47-291 bn121004211 · · · 05:03:18.1916 137.5 -11.0 9.4 Fermi-GBM 9 256 47-291 bn121005030 · · · 00:42:51.8894 195.2 -2.1 9.5 Fermi-GBM 14 2048 47-291 bn121005340 · · · 08:09:12.8647 149.7 25.4 5.4 Fermi-GBM 8 256 47-291 bn121008424 · · · 10:10:50.6583 341.0 -3.1 9.0 Fermi-GBM 9 256 47-291 bn121011469 GRB 121011A 11:15:25.6968 260.2 41.1 0.0 Swift 14 2048 47-291 L, S, W bn121012724 GRB 121012A 17:22:16.3864 33.4 14.6 6.8 Fermi-GBM 4 64 47-291 bn121014638 · · · 15:19:00.5847 320.4 -44.1 22.6 Fermi-GBM 11 512 47-291 bn121019233 · · · 05:35:09.2262 43.5 62.1 7.5 Fermi-GBM 16 4096 47-291 bn121023322 · · · 07:44:16.9457 313.9 -4.4 4.8 Fermi-GBM 4 64 47-291 bn121027038 · · · 00:54:19.3682 4.3 -47.5 2.6 Fermi-GBM 14 2048 47-291 bn121028280 · · · 06:43:13.0867 52.6 -25.1 7.7 Fermi-GBM 10 512 47-291 bn121029350 GRB 121029A 08:24:19.9338 226.8 -28.2 1.6 Fermi-GBM 4 64 47-291 W, ARR bn121031949 GRB 121031A 22:47:15.2674 170.8 -3.5 0.1 Swift 12 1024 47-291 S bn121102064 · · · 01:32:47.9367 258.5 14.1 12.1 Fermi-GBM 11 512 47-291 bn121104627 · · · 15:02:15.4945 72.1 14.1 4.1 Fermi-GBM 10 512 47-291

– 83 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn121109338 · · · 08:06:56.6318 6.8 -42.6 10.4 Fermi-GBM 13 1024 47-291 bn121112806 · · · 19:20:44.2651 79.0 -55.4 15.6 Fermi-GBM 6 128 47-291 bn121113544 · · · 13:02:43.5307 313.2 59.8 2.1 Fermi-GBM 16 4096 47-291 bn121116459 · · · 11:00:24.6005 180.9 -74.8 7.0 Fermi-GBM 4 64 47-291 bn121117018 · · · 00:25:37.7260 279.1 44.9 4.3 Fermi-LAT 13 1024 47-291 bn121118576 GRB 121118A 13:48:54.2563 307.2 63.2 2.4 Fermi-GBM 11 512 47-291 IP bn121119579 · · · 13:53:14.1341 311.6 -16.9 8.1 Fermi-GBM 4 64 47-291 bn121122564 · · · 13:31:27.5212 52.7 46.5 12.9 Fermi-GBM 9 256 47-291 bn121122870 · · · 20:52:49.0280 355.5 6.3 2.7 Fermi-GBM 11 512 47-291 bn121122885 GRB 121122A 21:14:52.5457 43.9 48.2 1.0 Fermi-GBM 6 128 47-291 IP, W, K bn121123421^{bb} GRB 121123A 10:06:00.5860 307.3 -11.9 0.0 Swift 17 4096 47-291 S, W bn121123442 · · · 10:35:55.7116 30.5 -18.8 1.6 Fermi-GBM 13 1024 47-291 bn121124606 · · · 14:32:07.2992 87.9 49.5 14.6 Fermi-GBM 1 16 47-291 bn121125356 GRB 121125A 08:32:29.6268 228.5 55.3 0.1 Swift 15 2048 47-291 S bn121125469 · · · 11:14:47.4902 177.5 38.5 5.2 Fermi-GBM 15 2048 47-291 bn121127914 GRB 121127A 21:56:00.3178 176.4 -52.4 0.3 IPN 3 32 47-291 IP, K, W bn121128212 GRB 121128A 05:05:50.9594 300.6 54.3 0.0 Swift 10 512 47-291 S, K bn121202181 GRB 121202A 04:20:09.1724 256.8 24.0 0.0 Swift 16 4096 47-291 S bn121205507 · · · 12:10:04.7144 238.6 -49.7 11.7 Fermi-GBM 8 256 47-291 bn121210081 · · · 01:56:01.5270 202.5 17.8 8.2 Fermi-GBM 14 2048 47-291 bn121211574 GRB 121211A 13:47:03.5899 195.5 30.2 0.0 Swift 10 512 47-291 S bn121211695 · · · 16:41:02.7692 72.4 8.6 5.2 Fermi-GBM 11 512 47-291 bn121216419 · · · 10:03:16.4501 13.9 -85.4 14.1 Fermi-GBM 8 256 47-291 bn121217313^{cc} GRB 121217A 07:30:01.5788 153.7 -62.4 0.0 Swift 14 2048 47-291 S bn121220311 · · · 07:28:13.2387 31.1 48.3 8.3 Fermi-GBM 10 512 47-291 bn121221916 · · · 21:59:29.9697 214.3 33.5 4.2 Fermi-GBM 14 2048 47-291 bn121223300 · · · 07:11:19.8116 50.1 21.4 2.7 Fermi-GBM 11 512 47-291 bn121225417 GRB 121225B 10:00:53.5827 310.5 -34.8 1.5 Fermi-GBM 11 512 47-291 L, K, W, IP bn121229533 · · · 12:47:33.3556 315.6 -11.9 4.6 Fermi-GBM 12 1024 47-291 bn121231445 · · · 10:41:23.2495 335.5 -17.8 6.5 Fermi-GBM 13 1024 47-291

– 84 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn130104721 · · · 17:18:07.0494 174.1 25.9 2.4 Fermi-GBM 8 256 47-291 bn130106829 · · · 19:53:22.0710 66.7 29.7 5.0 Fermi-GBM 14 2048 47-291 bn130106995 · · · 23:52:25.7922 28.8 63.4 1.9 Fermi-GBM 14 2048 47-291 bn130109206 · · · 04:56:26.2610 17.5 19.2 3.7 Fermi-GBM 8 256 47-291 bn130112286 · · · 06:52:07.5243 236.0 52.2 4.9 Fermi-GBM 9 256 47-291 bn130112353 · · · 08:27:47.7946 196.3 -31.9 5.8 Fermi-GBM 9 256 47-291 bn130114019 · · · 00:27:04.5494 310.2 -15.3 10.9 Fermi-GBM 12 1024 47-291 bn130115716 · · · 17:10:39.1815 171.1 22.6 2.8 Fermi-GBM 13 1024 47-291 bn130116415 · · · 09:58:14.2190 38.2 15.8 29.9 Fermi-LAT 16 4096 47-291 bn130117087 · · · 02:05:11.4251 341.2 2.8 6.2 Fermi-GBM 12 1024 47-291 bn130118482 · · · 11:33:29.3597 278.3 41.0 6.7 Fermi-GBM 12 1024 47-291 bn130121835 · · · 20:01:59.9675 211.3 -49.5 1.1 Fermi-GBM 12 1024 47-291 bn130123843 · · · 20:14:19.5954 314.6 -10.87 12.34 Fermi-GBM 11 512 47-291 bn130127299 · · · 07:09:53.1610 301.2 -57.2 10.0 Fermi-GBM 17 4096 47-291 bn130127743 GRB 130127A 17:50:23.9336 251.1 -17.1 8.5 Fermi-GBM 1 16 47-291 bn130131511 · · · 12:15:13.3852 189.6 -14.5 1.0 Fermi-GBM 12 1024 47-291 bn130204484 · · · 11:36:51.7036 105.6 41.9 7.1 Fermi-GBM 1 16 47-291 bn130206482 · · · 11:33:34.5031 269.1 49.4 2.4 Fermi-GBM 6 128 47-291 bn130206817 GRB 130206A 19:36:30.4519 140.4 -58.2 0.1 Swift 14 2048 47-291 S bn130208684 · · · 16:24:23.8357 181.6 50.9 4.7 Fermi-GBM 15 2048 47-291 bn130209961 · · · 23:03:41.7934 33.6 -27.6 1.0 Fermi-GBM 4 64 47-291 bn130213905 · · · 21:43:55.9587 99.1 -8.1 10.6 Fermi-GBM 15 2048 47-291 bn130214137 · · · 03:17:05.6627 325.0 -1.8 12.8 Fermi-GBM 17 4096 47-291 bn130214800 · · · 19:12:21.9995 56.9 -0.3 1.6 Fermi-GBM 12 1024 47-291 bn130215063 GRB 130215A 01:31:26.0239 43.5 13.4 0.1 Swift 12 1024 47-291 S, W bn130215649 · · · 15:34:16.1901 3.1 59.4 2.1 Fermi-GBM 16 4096 47-291 bn130216790 GRB 130216B 18:58:11.6954 58.9 2.0 0.0 Swift 4 64 47-291 S, W bn130216927 GRB 130216A 22:15:21.4191 67.9 14.7 0.0 Swift 7 128 47-291 S bn130217688 · · · 16:31:19.1189 96.7 6.8 8.2 Fermi-GBM 12 1024 47-291 bn130218261 · · · 06:16:25.5631 69.3 -69.1 2.3 Fermi-GBM 14 2048 47-291

– 85 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn130219197 · · · 04:44:07.5750 169.3 -22.2 2.2 Fermi-GBM 17 4096 47-291 bn130219626 · · · 15:01:13.9457 211.6 12.2 16.7 Fermi-LAT 5 64 47-291 bn130219775 GRB 130219A 18:35:51.7312 303.7 40.8 1.2 Fermi-GBM 8 256 47-291 K, W, IP bn130220964 · · · 23:08:48.2020 306.2 31.7 1.1 Fermi-GBM 8 256 47-291 bn130224370 · · · 08:53:02.3775 205.9 59.7 2.6 Fermi-GBM 16 4096 47-291 bn130228111 · · · 02:40:02.1659 255.5 55.0 0.5 Fermi-LAT 12 1024 47-291 IP bn130228212 · · · 05:05:57.0521 240.8 -55.2 1.3 Fermi-GBM 9 256 47-291 bn130304410 · · · 09:49:53.0995 98.9 53.6 1.2 Fermi-GBM 7 128 47-291 bn130304658 · · · 15:46:49.8928 178.9 -60.3 6.5 Fermi-GBM 12 1024 47-291 bn130305486 GRB 130305A 11:39:11.3693 116.8 52.0 0.1 Swift 14 2048 47-291 L, S, K bn130305526 · · · 12:37:47.7222 73.3 -1.6 1.8 Fermi-GBM 14 2048 47-291 bn130306991 GRB 130306A 23:47:25.5692 279.5 -11.7 0.1 Swift 17 4096 47-291 S, K bn130307126^c GRB 130307A 03:01:44.4714 156.0 23.0 1.5 IPN 5 64 47-291 IP bn130307238 · · · 05:42:19.3248 319.5 10.8 4.4 Fermi-GBM 17 4096 47-291 bn130310840 GRB 130310A 20:09:41.5028 142.3 -17.2 0.5 Fermi-LAT 11 512 47-291 L, K, W, IP, ARR bn130314147 · · · 03:31:16.2990 206.2 46.8 1.4 Fermi-GBM 12 1024 47-291 bn130318456 · · · 10:56:31.1793 200.7 8.1 9.9 Fermi-GBM 15 2048 47-291 IP, K bn130320560 GRB 130320B 13:26:34.5345 195.5 -71.3 1.0 IPN 17 4096 47-291 bn130324042 · · · 01:00:24.7467 255.4 0.1 6.0 Fermi-GBM 17 4096 47-291 bn130325005 · · · 00:07:46.8185 30.4 62.1 16.1 Fermi-GBM 5 64 47-291 bn130325203 GRB 130325A 04:51:54.2982 122.8 -18.9 0.2 Fermi-LAT 10 512 47-291 L, K, ARR bn130327350 GRB 130327B 08:24:04.0507 218.1 -69.5 0.2 Fermi-LAT 8 256 47-291 L, A, W, K, ARR bn130331566 · · · 13:35:44.8699 164.5 29.6 2.4 Fermi-GBM 14 2048 47-291 bn130403866 · · · 20:46:47.4103 199.9 -46.7 8.3 Fermi-GBM 16 4096 47-291 bn130404428 · · · 10:15:40.0522 30.8 1.5 7.2 Fermi-GBM 10 512 47-291 bn130404840 · · · 20:10:04.0277 146.6 -42.2 1.1 Fermi-GBM 9 256 47-291 bn130404877 · · · 21:02:11.0293 28.3 56.5 18.2 Fermi-GBM 7 128 47-291 bn130406288 · · · 06:55:03.4617 157.8 -62.0 2.1 Fermi-GBM 8 256 47-291 bn130406334 · · · 08:00:36.7662 109.7 -27.9 7.7 Fermi-GBM 16 4096 47-291 bn130406354 · · · 08:29:36.5804 138.2 42.8 14.8 Fermi-GBM 12 1024 47-291

– 86 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn130407800 · · · 7 19:12:43.0569 53.5 44.2 9.3 Fermi-GBM 17 4096 47-291 bn130408653 · · · 15:40:22.8549 118.8 66.3 3.9 Fermi-GBM 10 512 47-291 bn130409960 · · · 23:01:59.6575 30.5 44.1 2.2 Fermi-GBM 8 256 47-291 bn130416690 · · · 16:34:07.0615 99.3 24.7 14.3 Fermi-GBM 13 1024 47-291 bn130416770 · · · 18:28:53.2960 51.2 -18.2 4.9 Fermi-GBM 1 16 47-291 bn130418844 · · · 20:14:45.4863 216.5 -17.5 8.5 Fermi-GBM 15 2048 47-291 bn130420313 GRB 130420A 07:30:19.9249 196.1 59.4 0.0 Swift 14 2048 47-291 S bn130420343 · · · 08:14:02.2570 122.7 -11.4 1.2 Fermi-GBM 15 2048 47-291 bn130420422 · · · 10:08:09.1981 117.1 -69.0 4.0 Fermi-GBM 9 256 47-291 bn130420539 GRB 130420B 12:56:32.9879 183.1 54.4 0.0 Fermi-LAT 10 512 47-291 S bn130425327 GRB 130425A 07:51:16.2348 17.8 -72.8 1.5 Fermi-GBM 15 2048 47-291 IP, K, W bn130427324 GRB 130427A 07:47:06.4201 173.1 27.7 0.0 Swift 4 64 47-291 L, S, A, IA, K, M, R, ARR bn130502327 GRB 130502B 07:51:11.7608 66.8 71.1 0.0 Swift 12 1024 47-291 L, S, IP, IA, K, W bn130502743 GRB 130502A 17:50:30.7406 138.6 -0.1 0.0 Swift 8 256 47-291 S bn130503214 · · · 05:08:28.9490 214.7 -11.6 21.5 Fermi-GBM 4 64 47-291 bn130504314 GRB 130504B 07:32:03.3860 348.0 -5.7 1.5 IPN 1 16 47-291 IP, K, W, ARR bn130504978 GRB 130504C 23:28:57.5176 91.6 3.8 0.0 Swift 13 1024 47-291 L, S, K, W, ARR bn130505955 · · · 22:55:15.9425 344.5 -70.5 1.5 Fermi-GBM 4 64 47-291 bn130507545 · · · 13:04:37.9807 319.7 -20.5 3.3 Fermi-GBM 13 1024 47-291 bn130509078 · · · 01:52:14.7862 240.9 -40.2 2.1 Fermi-GBM 11 512 47-291 bn130509839 · · · 20:08:43.3547 133.9 -11.5 8.8 Fermi-GBM 17 4096 47-291 bn130510877 · · · 21:03:22.3817 105.7 -9.9 5.0 Fermi-GBM 16 4096 47-291 bn130514560 GRB 130514B 13:26:32.5304 147.6 -19.0 0.0 INTEGRAL 6 128 47-291 IS, S bn130515056 GRB 130515A 01:21:17.8757 283.4 -54.3 0.1 Fermi-LAT 1 16 47-291 S, K, W bn130515430 · · · 10:18:30.1691 312.8 -14.9 5.4 Fermi-GBM 16 4096 47-291 bn130515755 · · · 18:06:51.3906 146.8 11.3 10.5 Fermi-GBM 8 256 47-291 bn130517781 · · · 18:44:12.9807 41.9 42.7 1.5 Fermi-GBM 11 512 47-291 bn130518551 · · · 13:13:08.6135 289.7 -4.2 2.7 Fermi-GBM 5 64 47-291 bn130518580 GRB 130518A 13:54:37.5254 355.7 47.5 0.1 Swift 17 4096 47-291 L, S, K, W bn130522510 · · · 12:14:31.1354 134.1 17.6 4.9 Fermi-GBM 8 256 47-291

– 87 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn130523095 · · · 02:16:09.3830 22.3 29.7 2.8 Fermi-GBM 13 1024 47-291 bn130523198 · · · 04:45:42.2750 39.5 -63.1 2.1 Fermi-GBM 10 512 47-291 bn130527627 · · · 15:02:14.5422 175.8 -2.5 3.1 Fermi-GBM 9 256 47-291 bn130528503 · · · 12:04:31.3292 352.7 27.8 5.5 Fermi-GBM 10 512 47-291 bn130528695 GRB 130528A 16:41:24.4088 138.7 87.3 0.1 Fermi-LAT 9 256 47-291 S, K bn130530719 · · · 17:15:23.0060 160.9 25.2 1.0 Fermi-GBM 12 1024 47-291 bn130604033^d GRB 130604B 00:48:11.3219 292.2 -24.9 1.2 Fermi-GBM 8 256 47-291 bn130606316 · · · 07:35:30.4051 339.4 12.5 1.7 Fermi-GBM 12 1024 47-291 bn130606497 GRB 130606B 11:55:33.6313 218.6 -22.1 0.1 Fermi-LAT 12 1024 47-291 L, S, K, A, ARR bn130609129 GRB 130609A 03:05:10.6896 152.7 24.1 0.1 Swift 12 1024 47-291 S bn130609902 GRB 130609B 21:38:35.6097 53.8 -40.2 0.1 Swift 10 512 47-291 S, K, W bn130610133 GRB 130610A 03:12:10.5020 224.4 28.2 0.1 Swift 16 4096 47-291 S bn130611538 · · · 12:54:20.8697 238.8 -25.2 3.0 Fermi-GBM 10 512 47-291 bn130612141 GRB 130612A 03:22:23.3608 259.8 16.7 0.1 Swift 14 2048 47-291 S bn130612456 · · · 10:57:14.6280 247.9 31.0 1.8 Fermi-GBM 5 64 47-291 bn130614997 GRB 130614A 23:56:09.7442 324.2 -33.9 1.2 Fermi-GBM 4 64 47-291 W, ARR bn130615398 · · · 09:33:07.4623 184.9 69.6 6.2 Fermi-LAT 13 1024 47-291 bn130617564 · · · 13:32:49.8501 74.7 -60.1 10.0 Fermi-GBM 10 512 47-291 bn130620498 · · · 11:57:06.9268 74.4 61.2 12.3 Fermi-GBM 12 1024 47-291 bn130622615 · · · 14:45:53.2039 312.7 24.5 10.9 Fermi-GBM 4 64 47-291 bn130623130 · · · 03:06:37.1233 194.6 35.5 7.2 Fermi-GBM 8 256 47-291 bn130623396 · · · 09:30:24.0651 203.6 49.0 7.1 Fermi-GBM 15 2048 47-291 bn130623488 GRB 130623A 11:42:47.0459 20.7 -77.8 0.1 Swift 14 2048 47-291 S bn130623699 · · · 16:46:23.7895 284.7 10.7 26.3 Fermi-GBM 17 4096 47-291 bn130623790 · · · 18:57:50.9852 107.4 36.0 4.6 Fermi-GBM 12 1024 47-291 bn130624093 · · · 02:13:56.0837 337.3 11.4 6.9 Fermi-GBM 17 4096 47-291 bn130626452 GRB 130626A 10:51:03.8143 273.1 -9.5 0.1 Swift 5 64 47-291 S bn130626596 · · · 14:17:32.4917 24.9 4.9 4.0 Fermi-GBM 14 2048 47-291 bn130627372 GRB 130627A 08:55:05.9345 184.4 -37.1 0.1 Swift 10 512 47-291 S bn130628531 GRB 130628 12:44:02.1213 6.3 -5.1 1.7 Fermi-GBM 10 512 47-291 W, ARR

– 88 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn130628860 · · · 20:38:01.7893 312.8 6.1 5.0 Fermi-GBM 1 16 47-291 bn130630272 · · · 06:31:19.6994 170.0 60.1 1.0 Fermi-GBM 8 256 47-291 bn130701060 GRB 130701B 01:27:06.2735 97.8 -60.1 1.0 Fermi-GBM 14 2048 47-291 bn130701761 · · · 18:15:30.7128 325.9 -30.9 1.7 Fermi-GBM 5 64 47-291 bn130702004 GRB 130702A 00:05:23.0788 217.3 15.8 0.0 Swift 12 1024 47-291 L, S, IP, K, W bn130702951 · · · 22:48:59.5262 292.2 10.4 12.9 Fermi-GBM 12 1024 47-291 bn130704560 · · · 13:26:07.2534 65.6 -14.5 1.0 Fermi-GBM 8 256 47-291 bn130705398 · · · 09:33:03.9591 156.3 47.4 19.4 Fermi-GBM 2 32 47-291 bn130706900 · · · 21:36:07.8100 299.4 56.5 10.4 Fermi-GBM 1 16 47-291 bn130707505 · · · 12:07:48.9256 54.5 -21.0 5.4 Fermi-GBM 12 1024 47-291 bn130708488 GRB 130708A 11:43:04.2690 17.5 0.0 0.0 Swift 13 1024 47-291 S bn130715906 GRB 130715A 21:44:09.6416 287.4 -31.1 1.0 Fermi-GBM 15 2048 47-291 W bn130716352 · · · 08:26:19.2033 348.9 45.3 6.3 Fermi-GBM 14 2048 47-291 bn130716442 GRB 130716A 10:36:53.5881 179.6 63.1 0.0 Swift 6 128 47-291 S bn130717734 · · · 17:36:20.1112 256.6 -13.6 12.1 Fermi-GBM 9 256 47-291 bn130720116 · · · 02:46:40.7204 243.5 15.0 6.6 Fermi-GBM 8 256 47-291 bn130720582 · · · 13:57:40.4895 338.0 -9.4 1.0 Fermi-GBM 12 1024 47-291 bn130722021 · · · 00:29:51.0063 119.9 -47.5 10.1 Fermi-GBM 14 2048 47-291 bn130722990 · · · 23:46:11.7126 352.4 -22.3 2.7 Fermi-GBM 8 256 47-291 bn130723092 · · · 02:12:34.1223 217.8 -16.9 8.2 Fermi-GBM 8 256 47-291 bn130725527 · · · 12:38:40.7701 42.5 64.8 2.3 Fermi-GBM 9 256 47-291 bn130727698 GRB 130727A 16:45:20.9109 330.8 -65.5 0.0 Swift 10 512 47-291 S, K bn130730243 · · · 05:50:19.7425 133.8 -60.4 3.4 Fermi-GBM 14 2048 47-291 bn130802730 · · · 17:31:52.8030 80.3 -7.6 12.9 Fermi-GBM 4 64 47-291 bn130803419 GRB 130803A 10:02:53.7526 220.3 -2.5 0.0 Swift 11 512 47-291 S bn130804023 GRB 130804A 00:33:15.5270 280.0 -76.2 2.3 Fermi-GBM 1 16 47-291 IP, K, ARR bn130808253 · · · 06:04:33.6912 162.7 33.4 10.0 Fermi-GBM 4 64 47-291 bn130811186 · · · 04:28:01.6869 192.9 -17.0 3.4 Fermi-GBM 17 4096 47-291 bn130813791 · · · 18:59:22.7579 204.0 56.3 10.5 Fermi-GBM 14 2048 47-291 bn130815420 · · · 10:05:07.8860 164.7 49.6 1.6 Fermi-GBM 14 2048 47-291

– 89 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn130815660 · · · 15:50:52.2174 112.4 -2.1 1.0 Fermi-GBM 11 512 47-291 bn130816074 GRB 130816A 01:46:28.5150 197.1 -58.9 0.0 Swift 9 256 47-291 S bn130818941 · · · 22:34:33.7852 192.3 57.6 2.2 Fermi-GBM 11 512 47-291 bn130819394 · · · 09:27:34.0994 124.7 -33.8 4.9 Fermi-GBM 16 4096 47-291 bn130821674 GRB 130821A 16:10:28.0107 314.1 -12.0 0.1 Fermi-LAT 11 512 47-291 L, S, K, IP, ARR bn130828306 GRB 130828A 07:20:00.1535 259.8 28.2 0.3 IPN 16 4096 47-291 L, S, IP, ARR bn130828808 · · · 19:23:54.0005 188.2 27.9 2.4 Fermi-GBM 8 256 47-291 bn130829672 · · · 16:08:01.0727 258.5 6.0 1.7 Fermi-GBM 13 1024 47-291 bn130830864 · · · 20:44:49.5488 143.0 -0.6 7.7 Fermi-GBM 14 2048 47-291 bn130830921 · · · 22:06:33.5068 351.0 -51.6 10.5 Fermi-GBM 15 2048 47-291 bn130831058 · · · 01:24:13.7933 267.5 61.0 8.1 Fermi-GBM 14 2048 47-291 bn130903033 GRB 130903A 00:47:32.3749 82.1 -0.1 0.0 Swift 17 4096 47-291 S, IS bn130905377 · · · 09:02:11.4575 275.9 -2.3 2.2 Fermi-GBM 9 256 47-291 bn130906222 · · · 05:19:30.5381 194.1 4.2 12.4 Fermi-GBM 17 4096 47-291 bn130906435 · · · 10:26:25.2972 279.4 -53.4 7.6 Fermi-GBM 9 256 47-291 bn130907760^e · · · 18:14:46.5866 236.6 -25.1 7.4 Fermi-GBM 8 256 47-291 bn130908677 · · · 16:14:23.3416 219.2 -7.2 8.8 Fermi-GBM 17 4096 47-291 bn130909817^f · · · 19:36:08.8968 198.2 -20.8 17.2 Fermi-GBM 14 2048 47-291 bn130912358 GRB 130912A 08:34:57.9958 47.6 14.0 0.0 Swift 1 16 47-291 S, K bn130919173 · · · 04:09:40.2611 297.4 -11.7 5.3 Fermi-GBM 1 16 47-291 bn130919352 · · · 08:27:04.7354 59.8 48.5 5.7 Fermi-GBM 11 512 47-291 bn130919985 · · · 23:38:13.6953 242.2 -48.3 9.1 Fermi-GBM 8 256 47-291 bn130924255 · · · 06:06:49.0796 28.8 -7.1 6.0 Fermi-GBM 14 2048 47-291 bn130924910 · · · 21:51:01.6397 78.6 39.3 5.9 Fermi-GBM 9 256 47-291 bn130925164^g GRB 130925A 03:56:23.2864 41.2 -26.1 0.0 Swift 16 4096 47-291 bn130925173^g GRB 130925A 04:09:26.7335 41.2 -26.1 0.0 Swift 13 1024 47-291 S, Nu, K, M, ARR bn130925546 · · · 13:05:43.1266 83.4 55.3 4.1 Fermi-GBM 15 2048 47-291 bn130928537 · · · 12:52:35.1931 306.9 -44.2 3.3 Fermi-GBM 13 1024 47-291 bn130929375 · · · 09:00:13.0055 200.9 2.8 19.7 Fermi-GBM 15 2048 47-291 bn131002288 GRB 131002A 06:55:06.9937 253.2 82.1 0.0 Swift 16 4096 47-291 S

– 90 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn131004904 GRB 131004A 21:41:03.6823 296.1 -3.0 0.0 Swift 9 256 47-291 S bn131006367 GRB 131006 08:48:21.3645 325.4 -26.6 18.5 Fermi-GBM 7 128 47-291 bn131006840 GRB 131006 20:09:52.7074 139.4 -0.9 5.9 Fermi-GBM 12 1024 47-291 bn131008858 GRB 131008 20:36:02.7926 328.0 -26.0 2.5 Fermi-GBM 11 512 47-291 bn131011741 GRB 131011A 17:47:34.9871 32.5 -4.4 0.0 Swift 12 1024 47-291 S bn131014215 GRB 131014A 05:09:00.2020 100.5 -19.1 0.5 Fermi-LAT 4 64 47-291 S, L, W, IP, K, ARR bn131014513 · · · 12:18:36.1569 15.1 21.4 6.9 Fermi-GBM 13 1024 47-291 bn131018673 GRB 131018B 16:08:39.1814 304.4 23.1 0.1 Fermi-LAT 12 1024 47-291 L, S bn131020113 · · · 02:42:25.9168 209.0 51.1 19.8 Fermi-GBM 12 1024 47-291 bn131021352 · · · 08:26:45.4506 329.1 -25.4 6.4 Fermi-GBM 4 64 47-291 bn131024900 GRB 131024B 21:35:28.8457 144.5 44.3 0.0 Swift 16 4096 47-291 S, W bn131028076 GRB 131028A 01:49:02.3456 57.0 72.2 1.0 IPN 8 256 47-291 K, IP bn131028096^{dd} · · · 02:17:51.4315 333.4 -56.9 6.6 Fermi-GBM 13 1024 47-291 bn131029973 GRB 131029A 23:20:48.5784 200.8 48.3 0.3 Fermi-LAT 15 2048 47-291 L, W bn131029990 · · · 23:45:53.9333 110.3 -1.4 5.8 Fermi-GBM 14 2048 47-291 bn131030653 · · · 15:40:25.7561 61.5 -62.8 7.8 Fermi-GBM 13 1024 47-291 bn131030791 · · · 18:59:45.7718 186.3 -5.3 4.3 Fermi-GBM 10 512 47-291 bn131031482 GRB 131031A 11:33:32.8223 29.6 -1.6 0.0 Swift 8 256 47-291 S, K bn131102622 · · · 14:55:44.6227 74.1 -28.0 14.8 Fermi-GBM 15 2048 47-291 bn131105087 GRB 131105A 02:04:53.4912 71.0 -63.0 0.1 Swift 11 512 47-291 S, K bn131108024^{ee} · · · 00:34:42.8280 353.6 33.9 4.7 Fermi-GBM 10 512 47-291 bn131108862 GRB 131108A 20:41:55.7586 156.5 9.7 0.0 Swift 4 64 47-291 L, S, K, IP, A, ARR bn131110373 · · · 08:57:01.3429 9.8 8.2 4.0 Fermi-GBM 15 2048 47-291 bn131113483 · · · 11:35:37.1574 158.0 -41.5 1.2 Fermi-GBM 14 2048 47-291 bn131117766 · · · 18:23:30.4572 213.3 -2.5 2.1 Fermi-GBM 15 2048 47-291 bn131118958 GRB 131118A 22:58:57.4652 349.9 -66.8 0.1 IPN 13 1024 47-291 K, IP bn131119781 · · · 18:44:47.8739 48.0 -24.0 7.3 Fermi-GBM 10 512 47-291 bn131122490 · · · 11:45:05.3967 261.7 33.4 1.7 Fermi-GBM 15 2048 47-291 bn131123543^{ff} · · · 13:01:58.1342 53.2 -20.9 8.3 Fermi-GBM 11 512 47-291 bn131125689 GRB 131125A 16:32:51.0475 114.7 48.4 2.2 IPN 9 256 47-291 K, IP

– 91 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn131126163 GRB 131126A 03:54:10.4314 215.4 53.5 2.3 IPN 1 16 47-291 K, IP bn131127480 · · · 11:31:00.5888 49.4 -5.7 4.1 Fermi-GBM 11 512 47-291 bn131127592 GRB 131127B 14:12:18.3627 306.1 -0.8 1.0 Fermi-GBM 12 1024 47-291 K, IP bn131127696 · · · 16:41:46.3426 246.3 33.9 8.7 Fermi-GBM 14 2048 47-291 bn131128629 GRB 131128A 15:06:25.2829 355.3 31.3 0.0 Swift 12 1024 47-291 S bn131202633 GRB 131202A 15:12:10.8514 344.1 -21.7 0.0 Swift 16 4096 47-291 S bn131202906 · · · 21:45:20.4196 169.7 21.2 2.2 Fermi-GBM 15 2048 47-291 bn131204937 · · · 22:28:57.7867 309.7 -69.7 4.4 Fermi-GBM 10 512 47-291 bn131209547 GRB 131209A 13:07:56.9681 136.5 -33.2 0.9 Fermi-LAT 13 1024 47-291 L, K, IP bn131209963 · · · 23:06:16.4060 253.9 72.6 6.1 Fermi-GBM 9 256 47-291 bn131211510 · · · 12:14:49.9648 271.3 -40.6 3.6 Fermi-GBM 12 1024 47-291 bn131212814 · · · 19:32:29.8550 273.6 18.1 15.3 Fermi-GBM 14 2048 47-291 bn131214705 · · · 16:55:55.5955 183.9 -6.3 1.0 Fermi-GBM 9 256 47-291 bn131215298 · · · 07:08:45.1966 104.1 68.3 1.4 Fermi-GBM 12 1024 47-291 bn131216081 GRB 131216A 01:56:32.0627 91.6 -35.5 2.2 Fermi-GBM 4 64 47-291 L, IP, W, ARR bn131217108 · · · 02:36:11.5637 86.6 30.6 6.4 Fermi-GBM 9 256 47-291 bn131217183 · · · 04:23:28.0599 227.7 25.2 3.1 Fermi-GBM 5 64 47-291 bn131217506 · · · 12:08:26.4341 57.5 43.2 10.8 Fermi-GBM 13 1024 47-291 bn131229277 GRB 131229A 06:39:24.4835 85.2 -4.4 0.0 Swift 5 64 47-291 S, K, W bn131230529 · · · 12:41:27.1162 91.1 64.3 11.1 Fermi-GBM 15 2048 47-291 bn131230808 · · · 19:24:09.9048 73.1 4.8 3.9 Fermi-GBM 16 4096 47-291 bn131231198 GRB 131231A 04:45:16.0832 10.6 -1.6 0.0 Swift 13 1024 47-291 L, S, K, ARR bn140102887 GRB 140102A 21:17:37.8107 211.9 1.3 0.0 Swift 4 64 47-291 L, S, M, K, ARR bn140104731 GRB 140104B 17:32:03.1501 218.8 -8.9 0.2 Fermi-LAT 14 2048 47-291 L, S, W bn140105065 GRB 140105A 01:33:01.0137 208.2 50.2 6.1 Fermi-GBM 5 64 47-291 bn140105748 · · · 17:56:32.6420 252.9 19.0 4.0 Fermi-GBM 8 256 47-291 bn140106345 · · · 08:16:43.3570 2.3 -8.8 15.8 Fermi-GBM 13 1024 47-291 bn140108721 GRB 140108A 17:18:42.9877 325.1 58.7 0.0 Swift 13 1024 47-291 S, W bn140109771 · · · 18:30:06.1606 102.7 29.8 10.0 Fermi-GBM 8 256 47-291 bn140109877 · · · 21:03:26.3853 24.1 -25.1 37.5 Fermi-GBM 6 128 47-291

– 92 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn140110263 GRB 140110A 06:18:37.9358 28.9 -36.3 0.5 Fermi-LAT 8 256 47-291 L, S, IP bn140110411 · · · 09:52:04.2697 50.6 -69.3 11.7 Fermi-GBM 9 256 47-291 bn140110814 · · · 19:31:34.4468 31.9 65.2 3.2 Fermi-GBM 11 512 47-291 bn140112060 · · · 01:26:46.8944 8.4 12.0 7.1 Fermi-GBM 12 1024 47-291 bn140113183 · · · 04:23:55.4740 75.6 3.2 10.0 Fermi-GBM 16 4096 47-291 bn140113624 · · · 14:58:25.7934 329.4 18.1 12.3 Fermi-GBM 8 256 47-291 bn140115863 · · · 20:43:18.1771 210.0 -61.4 2.2 Fermi-GBM 9 256 47-291 bn140115899^h · · · 21:35:11.5049 94.9 -48.9 5.2 Fermi-GBM 11 512 47-291 bn140118064 GRB 140118A 01:32:07.8481 331.0 -17.9 0.1 Swift 16 4096 47-291 S bn140122597 · · · 14:19:47.7825 56.1 15.1 5.3 Fermi-GBM 9 256 47-291 bn140124527 · · · 12:38:31.1932 64.2 38.5 2.0 Fermi-GBM 9 256 47-291 bn140126815 · · · 19:33:41.6432 208.7 31.3 5.8 Fermi-GBM 9 256 47-291 bn140129499 · · · 11:59:01.6314 183.4 -10.3 9.1 Fermi-GBM 2 32 47-291 bn140204547 · · · 13:07:02.5600 166.1 62.5 5.6 Fermi-GBM 17 4096 47-291 bn140206275 GRB 140206B 06:36:12.8433 315.3 -8.5 0.2 Fermi-LAT 7 128 47-291 L, K, ARR bn140206304^i GRB 140206A 07:18:15.9826 145.3 66.8 0.0 Swift 14 2048 47-291 S, IS bn140209313 GRB 140209A 07:30:58.2301 81.3 32.5 0.0 Swift 9 256 47-291 S, K, ARR bn140211091 · · · 02:10:41.1630 115.8 -13.6 4.0 Fermi-GBM 11 512 47-291 bn140213807 · · · 19:21:32.3478 105.2 -73.1 0.0 Swift 9 256 47-291 S, K, ARR bn140216331 · · · 07:56:04.5922 194.0 31.5 13.7 Fermi-GBM 8 256 47-291 bn140217043 · · · 01:01:41.9986 359.4 76.8 3.1 Fermi-GBM 8 256 47-291 bn140218427 · · · 10:14:29.3275 347.5 44.5 3.6 Fermi-GBM 16 4096 47-291 bn140219319^j · · · 07:38:54.4495 221.9 50.0 8.2 Fermi-GBM 9 256 47-291 bn140219824 GRB 140219A 19:46:32.2410 158.2 7.2 2.2 Fermi-LAT 13 1024 47-291 L, IP, K, W, M bn140223495 · · · 11:53:06.1193 141.1 -30.4 5.6 Fermi-GBM 13 1024 47-291 bn140224382 · · · 09:10:17.1667 2.8 20.4 5.9 Fermi-GBM 9 256 47-291 bn140224788 · · · 18:55:19.8242 23.7 39.5 3.7 Fermi-GBM 14 2048 47-291 bn140227738 · · · 17:43:06.5865 235.3 31.5 8.2 Fermi-GBM 16 4096 47-291 bn140302342 GRB 140302A 08:12:58.8880 253.9 -12.9 0.0 Swift 5 64 47-291 S bn140304557 GRB 140304A 13:22:31.4824 30.6 33.5 0.0 Swift 12 1024 47-291 S, W

– 93 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn140304849 · · · 20:22:30.1436 354.2 -27.0 3.3 Fermi-GBM 15 2048 47-291 bn140306146 GRB 140306A 03:29:44.9509 27.9 49.0 0.2 IPN 4 64 47-291 W, K, IP, ARR bn140308710 · · · 17:02:38.6734 350.2 73.0 2.7 Fermi-GBM 10 512 47-291 bn140311453 · · · 10:52:04.8683 39.0 -25.2 5.3 Fermi-GBM 13 1024 47-291 bn140311618 GRB 140311C 14:49:13.0958 183.6 62.8 3.3 Fermi-GBM 8 256 47-291 bn140311885 GRB 140311B 21:14:35.6463 252.3 52.7 0.1 Swift 12 1024 47-291 S bn140319964 · · · 23:08:30.3595 136.0 81.5 3.6 Fermi-GBM 6 128 47-291 bn140320092 GRB 140320A 02:12:46.1129 281.9 -11.2 0.1 Swift 6 128 47-291 S bn140322424 · · · 10:11:03.4647 250.3 -69.5 6.6 Fermi-GBM 15 2048 47-291 bn140323433 GRB 140323A 10:22:53.1198 357.0 -79.9 0.0 Swift 13 1024 47-291 L, S, K, W bn140327065 · · · 01:33:05.8481 283.1 -6.2 5.3 Fermi-GBM 11 512 47-291 bn140328560 · · · 13:26:26.0279 320.0 18.0 14.7 Fermi-GBM 13 1024 47-291 bn140329272 · · · 06:31:21.7737 92.3 -41.1 9.2 Fermi-GBM 2 32 47-291 bn140329295^k GRB 140329A 07:04:38.3296 145.7 -32.2 0.2 Fermi-LAT 1 16 47-291 L, K, IP, ARR bn140330180 GRB 140330A 04:19:54.4722 328.1 -57.7 0.4 IPN 11 512 47-291 K, A, IP bn140402007 GRB 140402A 00:10:06.9977 207.6 6.0 0.1 Swift 5 64 47-291 L, S bn140404030^l · · · 00:43:26.0896 14.9 78.9 4.9 Fermi-GBM 14 2048 47-291 bn140404171 · · · 04:06:47.5138 172.7 33.2 2.2 Fermi-GBM 17 4096 47-291 bn140404900 · · · 21:36:17.6202 101.8 -7.0 2.6 Fermi-GBM 12 1024 47-291 bn140405033 · · · 00:47:02.5210 119.1 -26.9 3.9 Fermi-GBM 8 256 47-291 bn140406120 · · · 02:52:13.7577 357.5 5.6 2.6 Fermi-GBM 4 64 47-291 bn140406144 GRB 140406A 03:26:48.1850 70.1 13.5 5.9 Fermi-GBM 14 2048 47-291 bn140408553 GRB 140408A 13:15:55.2421 290.7 -12.6 0.0 Swift 12 1024 47-291 S bn140414693 · · · 16:38:37.9657 45.7 13.8 2.3 Fermi-GBM 8 256 47-291 bn140416060 GRB 140416A 01:26:40.9386 35.4 43.9 1.0 Fermi-GBM 5 64 47-291 K, IP bn140422194 · · · 04:38:45.4114 164.5 -62.6 6.8 Fermi-GBM 16 4096 47-291 bn140423356 GRB 140423A 08:32:38.5410 197.3 49.8 0.0 Swift 15 2048 47-291 S, K bn140426515 · · · 12:21:32.7403 174.5 -13.9 12.5 Fermi-GBM 17 4096 47-291 bn140427702 · · · 16:50:21.0705 131.9 27.5 23.3 Fermi-GBM 17 4096 47-291 bn140428906 GRB 140428B 21:44:38.5990 2.0 68.2 0.4 IPN 1 16 47-291 K, IP

– 94 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn140429975 · · · 23:24:41.7860 338.6 34.8 6.1 Fermi-GBM 16 4096 47-291 bn140430716^m · · · 17:11:23.8101 146.4 -36.9 1.8 Fermi-GBM 10 512 47-291 bn140501139^n GRB 140501A 03:19:41.4055 171.9 24.6 10.7 Fermi-GBM 5 64 47-291 bn140501497 · · · 11:55:10.4896 62.8 43.2 2.7 Fermi-GBM 9 256 47-291 bn140502354 GRB 140502A 08:30:20.1071 319.2 49.0 0.0 Swift 14 2048 47-291 S bn140506880 GRB 140506A 21:07:36.8773 276.8 -55.6 0.0 Fermi-LAT 5 64 47-291 S, K bn140508128 GRB 140508A 03:03:54.5981 255.5 46.8 0.0 Swift 8 256 47-291 S, K, IP, ARR bn140508179 · · · 04:17:41.4590 350.5 -63.8 5.0 Fermi-GBM 13 1024 47-291 bn140508629 · · · 15:05:26.1372 272.1 72.5 3.6 Fermi-GBM 13 1024 47-291 bn140511095 · · · 02:17:11.5603 329.8 -30.1 8.8 Fermi-GBM 2 32 47-291 bn140511995 · · · 23:53:09.4954 26.2 -24.9 3.6 Fermi-GBM 17 4096 47-291 bn140512814 GRB 140512A 19:31:42.5024 289.4 -15.1 0.1 Swift 17 4096 47-291 S, K bn140513724 · · · 17:22:12.2776 248.4 -19.5 3.9 Fermi-GBM 10 512 47-291 bn140516700 · · · 16:47:38.6622 115.2 4.3 7.8 Fermi-GBM 15 2048 47-291 bn140516765 · · · 18:21:00.8348 74.3 32.8 3.8 Fermi-GBM 10 512 47-291 bn140517813^o · · · 19:31:17.6918 127.8 13.6 2.2 Fermi-GBM 10 512 47-291 bn140518709 · · · 17:00:43.4248 244.0 -77.9 13.4 Fermi-GBM 11 512 47-291 bn140519043 · · · 01:01:44.9548 278.5 34.4 5.4 Fermi-GBM 14 2048 47-291 bn140521184 · · · 04:25:12.1435 308.7 38.9 10.1 Fermi-GBM 17 4096 47-291 bn140521732 GRB 140521A 17:34:18.7308 320.0 67.6 0.1 Swift 5 64 47-291 S bn140523129 GRB 140523A 03:05:57.6249 133.3 25.0 0.4 Fermi-LAT 7 128 47-291 L, K, IP bn140526449 · · · 10:47:04.8390 131.2 -4.2 3.7 Fermi-GBM 15 2048 47-291 bn140526571 · · · 13:42:54.7192 143.0 -10.9 6.2 Fermi-GBM 6 128 47-291 bn140528837 GRB 140528A 20:05:22.7497 280.7 -59.1 0.4 IPN 10 512 47-291 K, IP, ARR bn140603476 · · · 11:24:59.1393 217.4 25.9 2.1 Fermi-GBM 10 512 47-291 bn140605377 · · · 09:02:50.6508 121.8 -53.9 6.1 Fermi-GBM 1 16 47-291 bn140606133 GRB 140606B 03:11:51.8624 328.1 32.0 0.0 IPN 8 256 47-291 S, K, IP bn140608153 · · · 03:41:00.9766 151.2 -50.3 1.3 Fermi-GBM 14 2048 47-291 bn140608713 · · · 17:07:10.5093 212.0 53.8 2.9 Fermi-GBM 8 256 47-291 bn140610487 · · · 11:41:21.7575 199.1 35.9 8.2 Fermi-GBM 8 256 47-291

– 95 –

Table 5—Continued

Trigger ID GRB Name Time (UT) α (^∘) δ (^∘) Error Location Algorithm Timescale Energy Other Detections^a (^∘) Source (ms) (keV) and/or ARRs

bn140610548 · · · 13:09:06.4014 121.7 6.3 1.0 Fermi-GBM 15 2048 47-291 bn140610689 GRB 140610A 16:31:28.5839 286.3 3.9 0.1 Swift 17 4096 47-291 S, K bn140612294 · · · 07:03:33.3133 267.4 -64.1 4.7 Fermi-GBM 15 2048 47-291 bn140616165 · · · 03:57:05.1331 104.9 -70.5 7.0 Fermi-GBM 5 64 47-291 bn140619475 GRB 140619B 11:24:40.5200 132.7 -9.7 0.1 Fermi-LAT 4 64 47-291 L, W bn140619490 · · · 11:46:01.5322 305.0 -39.2 4.3 Fermi-GBM 5 64 47-291 bn140620219 GRB 140620A 05:15:28.0167 281.9 49.7 0.0 Swift 16 4096 47-291 S bn140621827 GRB 140621A 19:50:10.8941 25.1 22.4 0.7 IPN 1 16 47-291 K, W, IP bn140623224 GRB 140623A 05:22:06.6009 225.5 81.2 0.0 iPTF 16 4096 47-291 bn140624423 GRB 140624A 10:08:40.8955 23.2 -0.6 4.6 Fermi-GBM 1 16 47-291 ARR bn140626843 · · · 20:14:14.2478 120.8 38.8 6.6 Fermi-GBM 6 128 47-291 bn140627401 · · · 09:37:59.9156 66.5 -16.8 13.6 Fermi-GBM 16 4096 47-291 bn140628626 · · · 15:01:36.1224 226.0 -25.8 13.0 Fermi-GBM 17 4096 47-291 bn140628704 · · · 16:53:18.9797 359.1 31.6 9.0 Fermi-GBM 14 2048 47-291 bn140630505 · · · 12:07:52.8230 27.6 47.7 2.2 Fermi-GBM 14 2048 47-291 bn140701567 · · · 13:36:11.0738 351.5 -28.7 3.8 Fermi-GBM 13 1024 47-291 bn140701833 · · · 19:59:35.2574 285.4 -32.6 4.3 Fermi-GBM 15 2048 47-291 bn140703026 GRB 140703A 00:37:07.1903 13.0 45.1 0.0 Swift 14 2048 47-291 S bn140705539 · · · 12:55:28.7403 163.9 57.0 5.8 Fermi-GBM 14 2048 47-291 bn140706815 GRB 140706A 19:33:33.8638 49.3 -38.1 0.0 Swift 17 4096 47-291 S bn140709051 GRB 140709A 01:13:41.3769 304.6 51.2 0.1 Swift 12 1024 47-291 S bn140709637 GRB 140709B 15:17:52.8533 146.1 63.5 0.0 Swift 12 1024 47-291 S bn140710537 · · · 12:53:05.5155 2.8 -38.9 6.4 Fermi-GBM 5 64 47-291 bn140710901 GRB 140710B 21:37:37.9351 204.6 -58.6 0.0 INTEGRAL 16 4096 47-291 IS bn140711691 · · · 16:35:24.5665 166.0 -24.6 8.5 Fermi-GBM 17 4096 47-291 p aOther instrument detections: Mo: Mars Observer , K: Konus-Wind, R: RHESSI, IA: INTEGRAL SPI-ACS, IS: INTEGRAL IBIS-ISGRI, S: Swift, Me: Messenger, W: Suzaku, A: AGILE, M: MAXI, L: Fermi LAT, Nu: NuSTAR, iPTF: intermediate Palomar Transient Factory, ARR: Autonomous

– 96 –

Repoint Requests by GBM FSW aaGRB120801 There is a delayed emission at T0+∼400s. bGRB091024A triggered GBM twice.

bbGRB121123A GBM did not trigger on pre-trigger which triggered Swift; T90 is incorrect cGRB130307A possible precursors of this trigger were unobservable since it triggered soon after SAA exit. ccGRB121217A Swift triggered ∼12 min before T0. This GRB has several episodes well separated in time. Hence T90 is possibly incorrect dGRB130604B Fermi enters SAA ∼ 105s after trigger. ddGRB131028 This GRB triggrered during a X1.0 Solar Flare. eGRB130907 Fermi enters SAA ∼ 130s after trigger.

eeGRB131108 A second GRB131108A occurred ∼ 225s after this GRB triggered. f GRB130909 Fermi enters SAA ∼ 53s after trigger. ff GRB131123 This GRB triggrered during a M1.0 Solar Flare. gGRB130925A triggered GBM twice.

hGRB140115 Fermi enters SAA ∼ 50s after trigger.

iGRB130206A Swift-BAT triggered at 07:17:20 UT on first emission period of GRB1140206A, GBM on the second pulse at Swift T0+56s. jGRB140219 Fermi enters SAA ∼ 9s after trigger. kGRB140329A Fermi enters SAA ∼ 120s after trigger. lGRB140404 There is a precursor at T0- 70s. mGRB140329 Fermi enters SAA ∼ 155s after trigger. nGRB140329A Fermi enters SAA ∼ 60s after trigger. oGRB140517 Fermi enters SAA ∼ 65s after trigger. pGRB140627 Fermi enters SAA ∼ 190s after trigger.

– 97 –

Table 6. GRB Durations (50–300 keV)

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn080714086 3+4+8 5.376 ± 2.360 -0.768 2.816 ± 0.810 -0.256 bn080714425 0+9+10 40.192 ± 1.145 -4.352 11.776 ± 1.619 -1.280 bn080714745 5 59.649 ± 11.276 -0.512 25.088 ± 7.940 2.560 bn080715950 0+1+2+9+10 7.872 ± 0.272 0.128 6.144 ± 0.264 1.088 bn080717543 2+10 36.609 ± 2.985 -5.376 13.056 ± 0.810 1.024 bn080719529 6+7+9 16.128 ± 17.887 -4.352 8.448 ± 1.280 -2.048 bn080720316^a 6+7+9 16.128 ± 17.887 -4.352 8.448 ± 1.280 -2.048 bn080723557 4 58.369 ± 1.985 2.368 40.513 ± 0.231 14.208 bn080723913 0+1+3 0.192 ± 0.345 -0.064 0.064 ± 0.143 -0.064 bn080723985 2+5 42.817 ± 0.659 3.072 25.280 ± 0.405 12.160 bn080724401 3+4+6+7+8 379.397 ± 2.202 10.816 348.421 ± 0.923 17.216 bn080725435 0+1+3 25.920 ± 1.208 -2.816 10.048 ± 0.320 4.096 bn080725541 6+7+8 0.960 ± 1.292 -0.128 0.316 ± 0.178 0.004 bn080727964 0+3+4+6+7 89.089 ± 6.476 -13.312 21.504 ± 2.290 4.096 bn080730520 0+1+9+10 17.408 ± 6.229 -0.576 4.096 ± 1.448 2.496 bn080730786 0+1+6+9+10 13.312 ± 4.222 -0.576 4.096 ± 1.448 0.448 bn080802386 4+5 0.576 ± 0.091 -0.064 0.448 ± 0.091 0.000 bn080803772 0+1+2+5 26.240 ± 1.691 -0.256 11.072 ± 0.462 3.520 bn080804456 0+1+2+3+5 501.830 ± 6.476 -8.704 450.629 ± 2.896 3.584 bn080804972 6+7+8+11 24.704 ± 1.460 0.256 10.432 ± 0.429 3.520 bn080805496 0+1+3 29.440 ± 3.566 -1.792 17.408 ± 1.846 1.024 bn080805584 3+4+5 65.665 ± 14.676 -4.864 23.808 ± 1.202 1.536 bn080806584 1+2+5 2.304 ± 0.453 -2.112 0.960 ± 0.202 -1.152 bn080806896 0+1+2+9 75.777 ± 4.185 -35.328 28.032 ± 1.382 1.216 bn080807993 0+1+2+5 19.072 ± 0.181 0.000 15.808 ± 0.143 0.512 bn080808451 0+1+2+5 4.352 ± 0.832 -1.536 2.048 ± 0.640 -0.512 bn080808565 6+7+8+11 17.728 ± 1.489 1.728 5.248 ± 0.320 4.352 bn080808772 0+1+3 211.970 ± 6.557 -170.562 66.561 ± 2.896 -109.121 bn080809808 2+10 28.160 ± 2.896 -9.728 12.800 ± 2.290 -2.560 bn080810549 6+7+8+11 107.457 ± 15.413 -20.096 37.120 ± 0.923 5.952 bn080812889 3+4 15.040 ± 0.462 -1.792 7.488 ± 0.286 1.664 bn080815917 9+10 0.832 ± 0.320 -0.320 0.384 ± 0.181 -0.128 bn080816503 0+1+3+4+5 64.769 ± 1.810 1.280 23.296 ± 0.572 36.097 bn080816989 7+8+9+10+11 4.608 ± 0.453 -0.064 0.896 ± 0.580 0.128 bn080817161 1+2+5 60.289 ± 0.466 2.048 16.064 ± 0.202 7.744 bn080817720 3+4+8 4.416 ± 0.363 -0.080 1.536 ± 0.345 1.072 bn080818579 3+4+5 59.329 ± 8.749 -2.944 33.852 ± 1.491 0.005

– 98 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn080818945 1+3+5 13.376 ± 0.410 -0.512 6.080 ± 0.466 0.832 bn080821332 3+4 5.888 ± 0.264 -1.280 1.920 ± 0.181 0.256 bn080823363 1+3+4+5 43.457 ± 1.717 -1.280 15.424 ± 0.842 5.760 bn080824909 0+1+3 7.424 ± 2.005 -3.264 2.752 ± 0.231 0.320 bn080825593 0+1+2+9+10 20.992 ± 0.231 1.216 12.160 ± 0.091 3.072 bn080828189 1+2 3.008 ± 3.329 -0.128 1.280 ± 0.202 0.064 bn080829790 1+2 7.680 ± 0.377 -0.320 3.520 ± 0.264 1.088 bn080830368 0+1+3 40.896 ± 5.069 -1.536 9.088 ± 0.724 7.168 bn080831053^b 2+5 0.576 ± 1.168 -0.288 0.064 ± 0.631 -0.064 bn080831921 9+10+11 74.497 ± 1.243 1.344 50.689 ± 1.056 7.936 bn080904886 0+1+3+9 17.344 ± 1.385 -2.560 4.608 ± 0.373 4.032 bn080905499 3+6+7 0.960 ± 0.345 -0.064 0.704 ± 0.143 0.000 bn080905570 8+11 26.624 ± 2.896 -7.168 9.211 ± 2.287 0.005 bn080905705 7+8+11 105.984 ± 6.802 -5.120 78.336 ± 1.056 0.768 bn080906212 0+1+3+5 2.875 ± 0.767 0.005 1.280 ± 0.362 0.576 bn080912360 6+7+8+11 16.384 ± 2.896 -3.072 5.114 ± 2.415 0.006 bn080913735 9+10 41.217 ± 7.281 -0.256 10.240 ± 3.238 10.240 bn080916009 0+3+4+6+7 62.977 ± 0.810 1.280 32.000 ± 0.724 6.656 bn080916406 7+8+11 46.337 ± 7.173 0.512 18.432 ± 0.810 2.560 bn080919790 1+2+5 0.512 ± 0.405 -0.128 0.128 ± 0.091 -0.064 bn080920268 0+1+3+9 113.921 ± 3.125 -3.328 51.457 ± 2.673 3.584 bn080924766 0+1+2+9+10 39.937 ± 4.222 -11.264 13.307 ± 1.444 0.005 bn080925775 3+6+7+8 31.744 ± 3.167 -1.024 9.216 ± 1.448 4.096 bn080927480 7+8 45.313 ± 3.083 -0.256 11.520 ± 1.950 2.816 bn080928628 0+3+4+6+7 14.336 ± 4.007 -1.792 8.704 ± 0.810 -0.256 bn081003644 3+4 50.177 ± 3.692 -3.072 17.408 ± 1.448 9.728 bn081006604 0+1+3 6.400 ± 0.923 -0.256 2.301 ± 0.571 0.003 bn081006872 0+1+3 3.328 ± 1.305 -0.512 1.536 ± 0.810 -0.256 bn081008832 0+1+2+5 150.015 ± 12.892 0.004 110.338 ± 1.280 7.680 bn081009140 3+4+7+8 41.345 ± 0.264 1.344 2.688 ± 0.091 2.432 bn081009690^c 7+8+11 176.191 ± 2.127 0.003 25.088 ± 1.145 3.136 bn081012045 9+10+11 1.216 ± 1.748 -0.576 0.512 ± 0.362 0.000 bn081012549 6+9+10+11 30.721 ± 5.615 -5.376 6.912 ± 0.724 0.256 bn081017474 1+2+9+10 28.416 ± 2.757 -13.056 8.448 ± 1.619 -3.328 bn081021398 4+5 26.112 ± 3.974 -1.008 10.496 ± 1.145 2.064 bn081022364 3+4+5 17.152 ± 3.727 -2.560 5.376 ± 1.305 -0.512 bn081024245 8+10+11 0.832 ± 1.282 -0.832 0.512 ± 0.231 -0.576

– 99 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn081024851 1+3+4+5 56.065 ± 2.064 -0.512 24.320 ± 1.086 7.168 bn081024891 0+6+7+9 0.640 ± 0.264 -0.064 0.384 ± 0.181 0.000 bn081025349 3+4+7+8 22.528 ± 0.724 -0.512 16.384 ± 0.923 2.048 bn081028538 9+10+11 13.312 ± 1.280 -7.936 2.816 ± 0.362 -0.256 bn081101167 4+5 9.984 ± 9.051 -7.936 4.096 ± 1.086 -4.608 bn081101491 6+7+9 0.128 ± 0.091 -0.064 0.064 ± 0.091 0.000 bn081101532 2+5 8.256 ± 0.889 -0.256 4.416 ± 0.320 1.920 bn081102365 0+1+2+5 1.728 ± 0.231 -0.064 1.216 ± 0.143 0.128 bn081102739 0+3+4 34.817 ± 2.415 -0.512 17.152 ± 1.493 3.840 bn081105614 1+2+5 1.280 ± 1.368 -0.064 0.128 ± 0.091 -0.064 bn081107321 6+7+9+10+11 1.664 ± 0.234 -0.192 0.896 ± 0.143 0.256 bn081109293 0+1+2+9+10 58.369 ± 5.221 -6.912 17.408 ± 2.290 2.304 bn081110601 7+8 11.776 ± 2.573 0.256 4.608 ± 1.056 0.512 bn081113230 3+4 0.576 ± 1.350 0.000 0.320 ± 0.143 0.000 bn081115891 0+1+3+4+5 0.320 ± 0.653 -0.192 0.192 ± 0.264 -0.192 bn081118876 0+1+3+5 20.736 ± 1.379 0.256 4.608 ± 0.724 5.376 bn081119184 7+8+11 0.320 ± 0.680 -0.320 0.192 ± 0.231 -0.256 bn081120618 1+2+5 25.344 ± 0.923 -1.280 4.608 ± 0.572 0.256 bn081121858 10+11 41.985 ± 8.510 1.536 9.472 ± 1.145 6.656 bn081122520 0+1+3 23.296 ± 2.111 -0.256 13.568 ± 0.362 0.768 bn081122614 3+4+6+7+8 0.192 ± 0.091 -0.064 0.128 ± 0.091 -0.064 bn081124060 3+4+7+8 19.456 ± 1.086 0.512 9.728 ± 0.724 4.864 bn081125496 10+11 9.280 ± 0.607 0.512 3.200 ± 0.181 2.176 bn081126899 0+1+3 54.145 ± 0.923 -18.048 31.233 ± 0.362 0.768 bn081129161 10+11 62.657 ± 7.318 -0.128 16.384 ± 2.290 1.088 bn081130212 7+8+11 2.240 ± 1.002 -0.064 1.280 ± 0.905 0.064 bn081130629 9+10+11 45.569 ± 3.908 -38.657 28.417 ± 1.864 -25.856 bn081204004 0+1+2+9+10 7.424 ± 1.846 -5.632 1.280 ± 0.923 -0.768 bn081204517 6+7+8+11 0.192 ± 0.286 -0.064 0.128 ± 0.091 -0.064 bn081206275 9+10+11 24.576 ± 5.724 -11.264 10.752 ± 0.724 -1.792 bn081206604 3+4+5 7.936 ± 4.382 -2.048 3.072 ± 1.619 -1.024 bn081206987 9+10+11 22.528 ± 2.919 -5.888 5.888 ± 0.923 -0.768 bn081207680 0+1+9+10 97.282 ± 2.347 5.888 35.905 ± 0.462 24.896 bn081209981 8+11 0.192 ± 0.143 -0.064 0.128 ± 0.143 -0.064 bn081213173 0+1+2+5 0.256 ± 0.286 -0.256 0.192 ± 0.202 -0.192 bn081215784 9+10+11 5.568 ± 0.143 1.216 3.392 ± 0.091 1.728 bn081215880 2+5 7.680 ± 2.064 -0.256 5.632 ± 0.724 0.512

– 100 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn081216531 7+8+11 0.768 ± 0.429 0.000 0.128 ± 0.091 0.512 bn081217983 6+7+8+9+11 29.696 ± 12.892 -12.032 7.424 ± 0.724 3.584 bn081221681 1+2 29.697 ± 0.410 3.328 7.488 ± 0.143 19.392 bn081222204 0+1+2 18.880 ± 2.318 0.384 4.672 ± 0.231 2.368 bn081223419 6+7+9 0.576 ± 0.143 -0.064 0.256 ± 0.143 0.000 bn081224887 6+7+9 16.448 ± 1.159 0.736 4.672 ± 0.202 2.336 bn081225257 0+1+2+5 41.217 ± 5.667 -18.688 14.592 ± 0.923 -7.680 bn081226044 2+10 0.832 ± 1.032 -0.192 0.320 ± 0.264 -0.128 bn081226156 3+6+7+8 65.793 ± 1.619 -55.553 41.473 ± 0.572 -34.560 bn081226509 6+7+9 0.192 ± 0.143 -0.064 0.128 ± 0.143 -0.064 bn081229187 0+3+4+6 0.768 ± 0.724 -0.256 0.256 ± 0.572 0.000 bn081229675^a 0+3+4+6 0.768 ± 0.724 -0.256 0.256 ± 0.572 0.000 bn081230871 0+1+6+7+9 0.512 ± 0.272 -0.128 0.256 ± 0.202 -0.064 bn081231140 6+7+9 28.736 ± 2.611 0.640 16.832 ± 0.462 6.080 bn090101758 9+10 108.802 ± 1.619 -0.256 6.144 ± 0.724 89.858 bn090102122 9+10+11 26.624 ± 0.810 1.536 9.728 ± 0.572 6.400 bn090107681 11 18.432 ± 2.896 -2.048 9.212 ± 1.445 0.004 bn090108020 0+1+2+5 0.704 ± 0.143 -0.064 0.256 ± 0.091 0.000 bn090108322 0+1+2+10 0.192 ± 0.143 -0.064 0.128 ± 0.143 -0.064 bn090109332 8+11 1.728 ± 0.820 -0.256 0.512 ± 0.202 -0.192 bn090112332 0+1+3 58.369 ± 4.783 -15.104 24.320 ± 2.064 1.536 bn090112729 9+10 14.080 ± 5.126 -0.768 4.864 ± 0.362 1.792 bn090113778 0+1+2+9 17.408 ± 3.238 -2.048 6.141 ± 1.446 0.004 bn090117335 3+4+7+8 27.264 ± 1.286 -0.384 25.152 ± 0.320 0.384 bn090117632 0+1+9+10 75.777 ± 3.238 -50.177 41.985 ± 5.120 -22.528 bn090117640 0+1+2+9 15.552 ± 4.580 -5.248 2.240 ± 2.084 -0.128 bn090120627 1+2+5 1.856 ± 0.181 -0.512 1.024 ± 0.143 -0.192 bn090126227 6+7+9 5.632 ± 0.810 -1.792 2.816 ± 0.572 -0.768 bn090126245 3+4+6+7+8 0.960 ± 0.231 -0.384 0.640 ± 0.143 -0.256 bn090129880 0+1+3 16.640 ± 3.328 -0.256 6.144 ± 2.290 1.024 bn090131090 0+6+9+10 35.073 ± 1.056 3.072 22.272 ± 0.362 6.656 bn090202347 0+1+2+5 12.608 ± 0.345 0.192 5.376 ± 0.181 4.096 bn090206620 7+9+10+11 0.320 ± 0.143 -0.064 0.128 ± 0.143 0.000 bn090207777 0+1+2+9+10 24.832 ± 3.899 -0.512 7.424 ± 0.923 1.280 bn090213236 0+1+3+7 20.224 ± 6.192 -4.096 12.032 ± 3.114 -2.304 bn090217206 6+7+9+11 33.280 ± 0.724 0.832 9.728 ± 0.362 4.672 bn090219074 5 0.448 ± 0.272 -0.064 0.256 ± 0.345 0.000

– 101 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn090222179 9+10+11 17.408 ± 3.238 -2.048 8.192 ± 1.448 1.024 bn090225009 4 2.176 ± 2.833 -1.664 1.600 ± 0.286 -1.536 bn090227310 0+1+3+7 16.189 ± 0.831 0.003 7.424 ± 1.056 1.856 bn090227772 0+1+2 1.280 ± 1.026 -0.064 0.192 ± 0.091 0.000 bn090228204 0+1+3 0.448 ± 0.143 0.000 0.128 ± 0.091 0.000 bn090228976 6+7+9 7.936 ± 1.379 0.000 3.584 ± 1.145 0.512 bn090301315 0+1+3+4+5 23.296 ± 2.064 -17.664 5.632 ± 0.572 -3.584 bn090304216 6+7+8+9 2.816 ± 0.923 -0.256 2.048 ± 0.572 0.256 bn090305052 0+1+3+5 1.856 ± 0.580 -0.064 0.448 ± 0.091 0.256 bn090306245 0+1+3 27.904 ± 14.857 -2.816 11.264 ± 2.573 -0.256 bn090307167 9+10+11 29.440 ± 1.810 -5.120 18.432 ± 1.846 -1.792 bn090308734 3+4+6+7+8 1.664 ± 0.286 -0.320 0.576 ± 0.091 0.256 bn090309767 0+1+6+9 56.513 ± 5.146 -0.512 8.896 ± 0.916 34.561 bn090310189 7+8+11 116.930 ± 1.056 -0.384 57.089 ± 4.783 7.232 bn090316311 9+10+11 10.240 ± 1.557 -9.728 5.632 ± 0.572 -5.632 bn090319622 6+7+9 54.785 ± 2.202 -12.544 25.600 ± 1.086 5.888 bn090320045 6+7+9+11 2.368 ± 0.272 -2.112 1.344 ± 0.231 -1.664 bn090320418 6+7+8+11 7.936 ± 1.296 -1.664 2.624 ± 0.792 -0.768 bn090320801 9+10+11 29.184 ± 4.536 -0.512 10.240 ± 4.382 1.024 bn090323002 6+7+9+11 135.170 ± 1.448 8.192 53.249 ± 2.290 34.816 bn090326633 2+9+10 16.128 ± 3.208 -9.216 6.656 ± 0.724 -0.768 bn090327404 0+1+2+5 14.080 ± 1.379 1.280 5.888 ± 0.810 3.840 bn090328401 3+6+7+8 61.697 ± 1.810 4.352 14.592 ± 0.572 12.288 bn090328713 9+10+11 0.192 ± 1.032 -0.064 0.128 ± 0.143 0.000 bn090330279 6+7+9+10+11 73.473 ± 1.717 -51.969 21.248 ± 1.145 -6.144 bn090331681 6+7+9 0.832 ± 0.143 -0.064 0.704 ± 0.181 -0.064 bn090403314 3+6+7+8 14.848 ± 1.846 -2.304 6.656 ± 0.810 -0.512 bn090405663 7+8+11 0.448 ± 1.498 -0.064 0.192 ± 0.231 -0.064 bn090409288 3+4+5 30.337 ± 2.796 -24.064 12.736 ± 1.920 -8.960 bn090411838 0+2 21.501 ± 3.237 0.003 9.216 ± 1.448 3.072 bn090411991 4+5 14.336 ± 1.086 0.768 6.912 ± 0.724 4.352 bn090412061 3+4+8 0.896 ± 0.264 -0.832 0.128 ± 0.091 -0.128 bn090413122 6+7+8+9+11 32.513 ± 4.360 -22.272 9.216 ± 4.104 -3.072 bn090418816 7+8 0.320 ± 0.405 -0.064 0.256 ± 0.202 -0.064 bn090419997 0+1+2+5 166.915 ± 11.723 -65.793 58.113 ± 3.328 4.352 bn090422150 0+1+9 9.216 ± 0.362 -0.512 8.448 ± 0.362 -0.256 bn090423330 2+9+10 7.168 ± 2.415 -5.888 3.072 ± 1.280 -3.584

– 102 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn090424592 6+7+8+11 14.144 ± 0.264 0.512 3.072 ± 0.091 1.280 bn090425377 4 75.393 ± 2.450 3.584 9.344 ± 0.286 58.177 bn090426066 0+1+3+4+5 16.128 ± 5.152 -1.792 4.096 ± 1.056 -1.536 bn090426690 0+1+2+5 7.488 ± 2.496 -1.152 1.984 ± 0.272 0.320 bn090427644 6+7+9 1.024 ± 0.362 -1.792 0.256 ± 0.572 -1.536 bn090427688 1+2+5 12.288 ± 1.280 -1.024 6.400 ± 0.572 1.536 bn090428441 8+11 3.968 ± 1.506 -0.192 1.152 ± 0.716 0.448 bn090428552 4+5 31.489 ± 11.846 -8.448 7.168 ± 1.493 -0.256 bn090429530 2+10 14.336 ± 4.007 -2.560 5.628 ± 0.571 0.004 bn090429753 0+1+9 0.640 ± 0.466 -0.192 0.256 ± 0.143 0.000 bn090502777 7+8+11 66.048 ± 1.619 -9.728 41.984 ± 0.572 0.256 bn090509215 7+8+9+11 283.844 ± 2.463 -1.280 245.763 ± 1.448 5.056 bn090510016 6+7+9 0.960 ± 0.138 -0.048 0.256 ± 0.143 0.528 bn090510325 10+11 7.424 ± 1.717 -1.024 3.328 ± 0.923 0.256 bn090511684 9+10+11 7.616 ± 1.605 -1.472 2.496 ± 0.320 0.000 bn090513916 7+8+11 25.280 ± 7.146 -1.024 11.008 ± 1.691 4.480 bn090513941 5 11.776 ± 2.064 -3.840 6.400 ± 1.280 -1.792 bn090514006 0+1+3 43.521 ± 1.739 0.128 26.240 ± 1.105 1.600 bn090514726 7+8 2.240 ± 0.286 -0.640 0.636 ± 0.140 0.004 bn090514734 4+8 54.401 ± 4.077 -3.072 18.688 ± 1.086 6.592 bn090516137 3+6+7+8 118.018 ± 4.028 10.048 44.289 ± 3.005 50.753 bn090516353 0+3 123.074 ± 2.896 -36.097 47.297 ± 2.290 -2.304 bn090516853 3+4 14.464 ± 3.093 -0.096 6.173 ± 1.469 0.003 bn090518080 3+5 2.048 ± 0.410 -0.640 0.960 ± 0.181 -0.192 bn090518244 8+11 6.784 ± 1.000 -0.384 3.072 ± 1.145 0.256 bn090519462 3+6+7+9 91.329 ± 3.692 -18.944 31.937 ± 1.448 -10.752 bn090519881 0+1+2+9+10 74.177 ± 5.177 -1.536 26.625 ± 1.145 3.776 bn090520832 6+9 0.768 ± 0.834 -0.448 0.256 ± 0.181 -0.256 bn090520850 3+4+8 3.776 ± 0.923 -0.384 2.048 ± 0.572 0.320 bn090520876 0+1+3+5 30.657 ± 0.859 -18.176 7.104 ± 0.528 -0.768 bn090522344 3+4+6+7 20.288 ± 6.262 -4.864 5.184 ± 0.590 0.448 bn090524346 3+4+6+7+8 54.337 ± 0.870 0.896 37.121 ± 0.264 5.696 bn090528173^d 1+2+9+10 35.905 ± 2.187 -6.656 17.408 ± 0.604 1.216 bn090528516 3+4+6+7+8 79.041 ± 1.088 4.352 31.553 ± 0.320 12.544 bn090529310 6+7+9+11 3.072 ± 0.362 -0.512 1.792 ± 0.572 0.000 bn090529564 3+4+7+8 9.853 ± 0.179 0.003 8.576 ± 0.091 0.704 bn090530760 1+2+5 127.554 ± 1.319 3.392 58.753 ± 0.373 12.160

– 103 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn090531775 6+7+9 0.768 ± 0.231 0.000 0.384 ± 0.231 0.256 bn090602564 10+11 20.736 ± 7.209 -1.536 7.168 ± 1.086 1.024 bn090606471 2+10 8.064 ± 1.262 -1.280 5.568 ± 0.771 -0.384 bn090608052 1+2+5 21.504 ± 2.290 -16.384 6.144 ± 1.448 -4.096 bn090610648 1+3+4+5 6.144 ± 8.136 -4.096 1.280 ± 0.724 -0.512 bn090610723 9+10+11 144.896 ± 3.367 -2.560 100.096 ± 11.082 30.208 bn090610883 2+5 7.424 ± 1.639 -2.816 3.584 ± 0.724 -1.024 bn090612619 1+5 42.433 ± 2.888 -36.096 23.680 ± 2.052 -21.760 bn090616157 0+1+2+5 1.152 ± 1.168 -0.192 0.512 ± 0.231 0.000 bn090617208 0+1+3+5 0.192 ± 0.143 -0.064 0.064 ± 0.091 0.000 bn090618353 4 112.386 ± 1.086 7.936 23.808 ± 0.572 62.465 bn090620400 6+7+8+11 13.568 ± 0.724 0.512 3.840 ± 0.362 3.072 bn090620901 7+9+10+11 0.960 ± 0.272 -0.576 0.448 ± 0.231 -0.384 bn090621185 6+7+9 106.754 ± 14.373 -2.560 31.744 ± 2.429 8.448 bn090621417 6+7+9+10+11 27.008 ± 6.136 -3.840 17.344 ± 2.862 1.984 bn090621447 3+4+7+8 26.112 ± 5.655 -0.256 16.896 ± 0.923 1.536 bn090621922 2+5 0.384 ± 1.032 -0.128 0.128 ± 0.091 -0.064 bn090623107 7+8+9+11 47.105 ± 2.573 0.320 21.248 ± 1.379 3.904 bn090623913 0+1+6+9 7.168 ± 3.114 -0.256 3.328 ± 0.724 1.280 bn090625234 6+7+9 14.336 ± 0.923 -3.584 7.232 ± 0.572 -0.768 bn090625560 4+8 11.776 ± 2.673 -1.536 4.092 ± 0.721 0.004 bn090626189 0+1 48.897 ± 2.828 1.536 31.233 ± 0.362 4.096 bn090626707^e 0+1 48.897 ± 2.828 1.536 31.233 ± 0.362 4.096 bn090629543 3+6+7+8 20.480 ± 4.762 -9.472 9.728 ± 1.493 -1.792 bn090630311 1+2+9+10 2.880 ± 0.320 -0.640 0.960 ± 0.181 0.000 bn090701225 0+1+3 4.160 ± 0.692 -3.520 1.344 ± 1.159 -1.536 bn090703329 0+1+9 8.960 ± 1.864 -2.304 3.072 ± 0.923 -0.512 bn090704242 1+2 69.889 ± 5.724 0.512 32.257 ± 1.493 15.104 bn090704783 0+1+6+9 19.456 ± 2.064 -1.792 7.936 ± 1.379 1.280 bn090706283 6+9 119.810 ± 5.030 -35.841 59.137 ± 4.199 -12.800 bn090708152 0+1+2+3+5 21.248 ± 3.167 -3.840 7.680 ± 1.619 -1.280 bn090709630 0+1+2+3+5 22.272 ± 9.230 0.512 4.096 ± 0.810 1.792 bn090711850^f 6+7+9 51.969 ± 2.560 -0.768 23.552 ± 2.290 9.216 bn090712160 0+1+3 87.041 ± 7.799 -65.537 31.744 ± 7.799 -22.528 bn090713020 7+9+11 82.817 ± 2.318 1.344 27.392 ± 0.429 9.536 bn090717034 0+1+2+9+10 65.537 ± 1.557 2.304 43.009 ± 0.572 6.144 bn090717111 3+6+7+8 0.384 ± 0.181 -0.192 0.192 ± 0.143 -0.128

– 104 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn090718720 3+6+7 76.481 ± 3.416 -0.768 31.681 ± 2.085 5.760 bn090718762 9+10+11 23.744 ± 0.802 3.392 8.448 ± 0.231 14.016 bn090719063 7+8 11.392 ± 0.466 0.896 3.904 ± 0.143 3.136 bn090720276 2+5 3.712 ± 0.724 -1.088 1.597 ± 0.407 0.003 bn090720710 0+1+3+5 10.752 ± 1.056 -0.256 6.144 ± 0.572 0.000 bn090725838 8+11 13.760 ± 1.229 -3.328 8.448 ± 0.859 -0.768 bn090726218^e 0+1+2 7.680 ± 0.724 -0.256 3.840 ± 0.572 1.536 bn090730608 1+2+9+10 9.088 ± 1.680 -1.664 3.648 ± 0.320 0.320 bn090802235 2+5 0.128 ± 0.091 -0.064 0.064 ± 0.091 0.000 bn090802666 8+11 27.520 ± 6.192 -0.768 11.968 ± 0.659 1.792 bn090804940 3+4+5 5.568 ± 0.362 0.640 2.560 ± 0.143 1.664 bn090805622 10+11 46.592 ± 2.318 -0.768 20.480 ± 1.448 3.328 bn090807832 6+7+8+9+11 17.920 ± 2.757 -1.280 8.192 ± 2.573 -0.256 bn090809978 3+4+5 11.008 ± 0.320 1.088 3.776 ± 0.091 2.752 bn090810659 2+5 123.458 ± 1.747 1.152 75.201 ± 2.073 38.337 bn090810781 3+4+5 62.977 ± 11.865 0.192 19.712 ± 1.895 4.992 bn090811696 0+1+9 14.848 ± 1.145 -0.256 12.800 ± 0.810 0.000 bn090813174 6+7+9 7.552 ± 0.362 0.384 5.888 ± 0.286 0.640 bn090814368 6+7+9+10+11 0.192 ± 0.143 -0.064 0.128 ± 0.091 0.000 bn090814950 9+10+11 108.610 ± 8.816 -0.256 52.673 ± 2.790 26.048 bn090815300 7+8 48.385 ± 1.086 -1.536 20.224 ± 1.280 2.560 bn090815438 7+8+11 56.321 ± 18.461 -36.865 15.360 ± 3.692 1.024 bn090815946 0+1+2+9 212.992 ± 1.950 -2.304 186.624 ± 2.111 7.936 bn090817036 3+4 52.417 ± 10.657 -13.440 13.312 ± 2.111 1.088 bn090819607 3+6+7+8 0.192 ± 0.202 -0.128 0.064 ± 0.091 -0.064 bn090820027 2+5 12.416 ± 0.181 31.169 4.480 ± 0.091 33.153 bn090820509 6+7+9 15.296 ± 4.610 -0.128 10.301 ± 0.602 0.003 bn090823133 6+7+8+11 63.361 ± 4.545 -53.249 42.177 ± 1.619 -38.913 bn090824918 2 59.905 ± 10.014 -4.608 34.817 ± 1.843 0.512 bn090826068 0+1+3+5 8.704 ± 2.862 -1.024 7.424 ± 0.923 -0.256 bn090828099 4+5 68.417 ± 3.167 -1.024 10.752 ± 0.320 45.825 bn090829672 0+6+7+9+10+11 67.585 ± 2.896 10.240 12.288 ± 1.448 39.937 bn090829702 0+6+7+9+10+11 101.633 ± 2.290 1.792 31.232 ± 2.573 6.400 bn090831317 4+5 39.424 ± 0.572 0.000 22.272 ± 0.810 7.680 bn090902401 7+8 3.200 ± 1.797 -2.304 0.896 ± 0.286 -0.256 bn090902462 0+1+9 19.328 ± 0.286 2.816 9.024 ± 0.181 8.896 bn090904058 2+9+10 56.065 ± 1.846 -3.072 34.305 ± 1.002 7.936

– 105 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn090904581 1+2+9+10 38.401 ± 3.093 -2.560 20.992 ± 1.379 3.584 bn090907017 4 39.489 ± 4.443 -12.800 13.248 ± 2.233 1.088 bn090907808 3+6+7+8+9 0.832 ± 0.320 -0.256 0.448 ± 0.143 0.000 bn090908314 9+10+11 67.329 ± 4.700 -59.137 50.433 ± 1.864 -49.665 bn090908341 3+4+5 36.864 ± 0.923 -0.256 15.872 ± 1.305 4.608 bn090909487 8 14.336 ± 2.896 -4.096 7.168 ± 2.896 -1.024 bn090909854 0+1+6+9+10 1.152 ± 2.244 -0.768 0.384 ± 0.202 -0.064 bn090910812 4+8 53.441 ± 13.334 0.832 26.881 ± 0.923 7.232 bn090912660 3+4+5 147.651 ± 9.718 -0.768 88.257 ± 2.534 12.224 bn090915650 0+1+2 76.609 ± 1.559 -0.768 25.792 ± 1.785 2.304 bn090917661 0+3+4+6 26.624 ± 1.134 -0.192 15.360 ± 0.689 1.088 bn090920035 2+10 26.624 ± 1.056 -7.680 12.800 ± 0.810 -3.840 bn090922539 0+1+6+7+9 87.041 ± 0.810 0.512 4.864 ± 0.572 1.792 bn090922605 8+11 52.736 ± 1.810 0.000 20.224 ± 1.056 5.120 bn090924625^b 0+9+10 0.352 ± 0.101 -0.064 0.096 ± 0.072 -0.032 bn090925389 8+11 25.472 ± 3.525 0.064 11.456 ± 1.275 3.776 bn090926181 3+4+6+7+8 13.760 ± 0.286 2.176 6.528 ± 0.143 4.224 bn090926914 7+8+11 55.553 ± 7.638 1.088 17.984 ± 1.262 13.120 bn090927422 10 0.512 ± 0.231 -0.192 0.320 ± 0.202 -0.128 bn090928646 4+8 15.616 ± 2.611 -0.256 2.816 ± 0.923 1.024 bn090929190 8 6.174 ± 1.298 0.003 2.816 ± 0.572 0.800 bn091002685 6+7+9 2.752 ± 3.089 -1.344 0.640 ± 0.286 -0.320 bn091003191 7+9 20.224 ± 0.362 0.832 13.312 ± 0.724 5.696 bn091005679 6+7+8+11 6.976 ± 0.572 -4.672 3.136 ± 0.730 -1.984 bn091006360 1+2+5 0.192 ± 0.091 -0.192 0.064 ± 0.181 -0.128 bn091010113 3+4+6 5.952 ± 0.143 0.128 1.088 ± 0.580 1.984 bn091012783 10+11 0.704 ± 2.499 0.000 0.320 ± 0.091 0.256 bn091015129 5 3.840 ± 0.590 -2.304 1.472 ± 0.320 -1.536 bn091017861 3+4+5 2.624 ± 0.462 -0.832 0.960 ± 0.231 -0.384 bn091017985 0+1+3+7+9 44.800 ± 3.367 -1.792 16.640 ± 2.360 2.048 bn091018957 11 0.192 ± 0.286 -0.064 0.064 ± 0.091 -0.064 bn091019750^g 0+1+2 0.208 ± 0.172 -0.112 0.016 ± 0.036 -0.032 bn091020900 2+5 24.256 ± 7.973 -3.584 6.912 ± 0.668 1.664 bn091020977 0+1+3+4+5 37.505 ± 0.905 0.992 21.696 ± 0.373 2.848 bn091023021 2+4+5 6.528 ± 1.857 -0.448 1.792 ± 0.345 -0.192 bn091024372^h 7+8+11 93.954 ± 5.221 -3.072 39.937 ± 1.056 4.352 bn091024380^h 6+7+9 450.569 ± 2.360 2.048 100.610 ± 0.923 222.724

– 106 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn091026485 1+2 3.328 ± 0.779 -0.896 1.536 ± 0.286 -0.384 bn091026550 4 8.960 ± 1.379 -5.120 3.840 ± 0.810 -4.096 bn091030613 3+4+6+7 19.200 ± 0.871 0.576 9.472 ± 0.345 5.504 bn091030828 8+10+11 98.050 ± 4.128 0.832 24.832 ± 1.493 7.232 bn091031500 1+6+7+9 33.921 ± 0.462 1.408 8.192 ± 0.231 7.040 bn091101143 10+11 10.688 ± 0.842 0.192 5.056 ± 0.320 1.728 bn091102607 2+10 6.656 ± 3.435 -0.768 2.813 ± 1.618 0.003 bn091103912 3+4+5 13.568 ± 6.023 -2.048 4.288 ± 0.373 0.832 bn091106762 10 14.592 ± 16.147 -1.280 11.008 ± 0.923 1.280 bn091107635 0+3+4+6+7 11.008 ± 10.546 -2.816 2.048 ± 0.572 -0.512 bn091109895 0+1+3 30.976 ± 4.580 -5.376 20.224 ± 2.064 0.768 bn091112737 3+4+5 24.576 ± 0.923 -0.768 7.680 ± 0.362 3.840 bn091112928 1+3+4+5 21.184 ± 0.977 -0.768 9.664 ± 0.659 3.648 bn091115177 0+1+3+5 37.376 ± 2.360 -1.536 18.432 ± 1.639 8.192 bn091117080 2+5 113.664 ± 2.360 -4.352 96.000 ± 1.145 4.352 bn091120191 0+1+3+5 50.177 ± 2.111 1.024 20.992 ± 2.290 9.216 bn091122163 7+9+11 1.984 ± 1.925 -1.472 0.448 ± 1.368 -0.256 bn091123081 8+11 15.552 ± 1.866 -9.984 5.376 ± 0.604 -1.344 bn091123298^c 2+5 604.491 ± 11.676 4.096 365.574 ± 8.749 63.489 bn091126333 7+8+11 0.192 ± 0.091 -0.064 0.128 ± 0.091 -0.064 bn091126389^i 7+8+11 0.192 ± 0.091 -0.064 0.128 ± 0.091 -0.064 bn091127976 6+7+9 8.701 ± 0.571 0.003 5.120 ± 0.362 0.512 bn091128285 9+10 87.810 ± 13.662 -23.297 22.528 ± 3.238 5.120 bn091201089 6+7+8+9+11 12.992 ± 2.010 -7.744 5.952 ± 0.951 -4.288 bn091202072 0+1+3+5 27.648 ± 3.566 -5.120 10.240 ± 0.923 -0.768 bn091202219 9+10+11 111.106 ± 3.692 -38.913 40.449 ± 2.560 6.144 bn091207333 0+1+9+10 27.073 ± 0.916 0.256 8.000 ± 0.607 2.432 bn091208410 0+9+10 12.480 ± 5.018 -0.128 7.168 ± 0.630 1.856 bn091209001 4 42.945 ± 8.035 -5.888 11.392 ± 0.771 2.304 bn091215234 3+4+5 4.352 ± 0.362 -2.048 2.304 ± 0.362 -1.536 bn091219462 0+1+9 8.128 ± 1.866 -0.192 2.048 ± 0.643 0.192 bn091220442 0+1+9+10 18.368 ± 0.590 0.384 5.696 ± 0.345 2.048 bn091221870^j 6+7+9+10+11 23.040 ± 5.177 6.144 9.216 ± 1.056 14.592 bn091223191 3+6+7+8 0.576 ± 0.181 -0.256 0.192 ± 0.143 -0.192 bn091223511 1+2+9+10 49.725 ± 1.379 0.004 19.840 ± 0.462 7.360 bn091224373 1+2 0.768 ± 0.231 -0.192 0.384 ± 0.143 -0.128 bn091227294 1+2+5 21.888 ± 0.889 -1.280 7.232 ± 0.792 2.048

– 107 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn091230260 6+7+8+9+11 62.976 ± 3.874 -3.840 36.096 ± 1.493 0.000 bn091230712 8+11 35.137 ± 3.974 -0.512 7.424 ± 0.945 1.920 bn091231206 0+3+4+6+7 42.561 ± 3.664 2.624 17.984 ± 1.002 7.232 bn091231540 3+4+5 15.616 ± 2.757 -7.680 4.352 ± 0.724 -0.768 bn100101028 3 2.816 ± 0.320 -0.256 1.344 ± 0.091 -0.128 bn100101988 0+6+9+10 1.984 ± 2.049 -1.024 0.832 ± 0.143 -0.512 bn100107074^g 0 0.576 ± 0.465 -0.048 0.032 ± 0.179 -0.048 bn100111176 3+6+7 19.520 ± 5.367 -10.752 6.784 ± 0.810 -4.096 bn100112418 0+1+3+4+5 23.040 ± 0.572 -4.352 9.472 ± 0.923 -0.768 bn100116897 0+1+3 102.530 ± 1.485 0.576 5.504 ± 0.181 89.602 bn100117879 3+4+8 0.256 ± 0.834 -0.064 0.064 ± 0.181 0.000 bn100118100 1+2+5 9.216 ± 6.720 -2.304 2.560 ± 0.923 -0.768 bn100122616 6+7+9 22.528 ± 2.769 5.120 2.304 ± 0.572 20.736 bn100126460 1+2+5 10.624 ± 12.673 -1.280 9.088 ± 1.243 -0.512 bn100130729 0+3+4+6+7 99.074 ± 3.328 -6.400 13.568 ± 0.724 63.745 bn100130777 7+8+11 86.018 ± 6.988 -10.240 34.049 ± 1.493 5.632 bn100131730 6+7 3.520 ± 0.453 0.192 1.408 ± 0.202 0.576 bn100201588 0+6+7+9+10+11 122.114 ± 1.280 0.256 74.241 ± 1.864 17.152 bn100204024 6+7+9+10+11 136.195 ± 27.553 -95.234 21.504 ± 2.896 -7.168 bn100204566 2+5 32.513 ± 2.862 -30.209 20.480 ± 0.572 -22.529 bn100204858 10+11 1.920 ± 2.375 -0.640 0.256 ± 0.202 -0.192 bn100205490 10+11 14.848 ± 2.290 -1.024 3.584 ± 1.145 0.000 bn100206563^g 0+1+3 0.128 ± 0.091 -0.064 0.064 ± 0.143 0.000 bn100207665 4+5 15.360 ± 3.874 -2.816 8.192 ± 0.724 -0.768 bn100207721 0+1+3+5 17.728 ± 6.492 -9.216 8.768 ± 1.073 -3.072 bn100208386 0+1+9 0.192 ± 0.264 -0.064 0.128 ± 0.091 -0.064 bn100210101 0+1+2+9+10 29.184 ± 5.655 -10.240 5.632 ± 1.145 -1.024 bn100211440 10+11 21.376 ± 0.923 0.640 8.960 ± 0.373 7.360 bn100212550 6+7+9 3.773 ± 0.270 0.003 2.368 ± 0.231 0.768 bn100212588 0+3 2.496 ± 0.202 -0.448 0.768 ± 0.143 -0.256 bn100216422 6+9+11 0.192 ± 0.143 -0.064 0.128 ± 0.091 -0.064 bn100218194 0+1+9 29.185 ± 5.813 -3.584 13.696 ± 2.033 1.664 bn100219026 2+5 59.712 ± 4.955 -12.416 26.880 ± 1.336 1.152 bn100221368 3+4+5 23.552 ± 1.032 -3.328 8.960 ± 0.551 0.320 bn100223110 7+8+11 0.256 ± 0.091 -0.064 0.064 ± 0.091 0.064 bn100224112 3+4 67.329 ± 6.988 -3.584 7.936 ± 1.459 10.816 bn100225115 0+1+3+4+5 12.992 ± 1.925 -0.256 5.056 ± 0.320 3.136

– 108 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn100225249 2+5 32.000 ± 20.419 -0.512 16.896 ± 7.701 2.560 bn100225580 0+1+3+4+5 6.400 ± 1.086 -0.512 2.304 ± 0.724 1.536 bn100225703 0+6+9+10+11 4.480 ± 1.431 -1.152 1.920 ± 0.572 0.000 bn100228544 9+10+11 67.072 ± 4.720 -3.072 33.280 ± 1.846 3.072 bn100228873 0+6+9+10+11 8.704 ± 2.318 -2.048 3.072 ± 0.810 -1.280 bn100301068 6+9 0.960 ± 1.002 -0.896 0.064 ± 0.091 -0.064 bn100301223 0+9+10 26.625 ± 1.431 -0.256 6.784 ± 0.932 2.944 bn100304004 8+11 181.507 ± 21.682 -2.560 97.538 ± 16.766 10.752 bn100304534 2 19.008 ± 2.782 -9.472 5.888 ± 1.132 -1.024 bn100306199 6+7+8+11 7.168 ± 2.064 -4.352 3.328 ± 0.572 -3.072 bn100307928 9+10+11 16.128 ± 2.187 -3.072 6.400 ± 1.379 -0.768 bn100311518 3+4+5 9.024 ± 1.042 -0.256 3.968 ± 0.572 2.240 bn100313288 0+9+10 12.864 ± 2.099 -2.816 3.904 ± 0.286 0.832 bn100313509 6+7+9+11 34.048 ± 2.996 -3.072 17.408 ± 1.280 2.560 bn100315361 0+1+3 35.584 ± 2.290 -4.608 16.896 ± 1.086 -0.256 bn100318611 9+10+11 18.432 ± 0.923 -1.792 7.168 ± 0.724 0.000 bn100322045 1+2+5 37.121 ± 0.231 1.152 26.368 ± 0.181 7.424 bn100323542 8+11 60.673 ± 3.620 -5.632 53.505 ± 1.950 -0.768 bn100324172 1+2+5 17.920 ± 2.064 0.576 3.840 ± 0.362 2.368 bn100325246 0+1+3 8.192 ± 1.086 -1.536 4.608 ± 0.572 -0.512 bn100325275 0+1+3 7.104 ± 1.619 -0.384 4.096 ± 0.724 0.576 bn100326294 9+10 5.632 ± 2.064 -5.376 3.584 ± 2.111 -3.584 bn100326402 3+4+5 171.011 ± 29.126 -72.705 36.865 ± 5.793 -5.120 bn100328141 6+7+9+11 0.384 ± 0.143 -0.064 0.192 ± 0.091 0.064 bn100330309 7+9+10+11 10.048 ± 0.318 0.064 4.096 ± 0.272 1.280 bn100330856 0+1+3+9 5.120 ± 0.453 -1.152 1.024 ± 0.466 -0.640 bn100401297 0+1+2+3+5 92.416 ± 4.291 -6.656 79.616 ± 0.724 -0.256 bn100406758 1+2+5 5.888 ± 2.919 -1.280 2.557 ± 1.377 0.003 bn100410356 4+8 9.728 ± 2.202 -5.888 3.328 ± 1.086 -3.328 bn100410740 1+2+5 22.016 ± 4.700 -1.024 14.080 ± 4.222 1.280 bn100411516 9+10+11 0.512 ± 0.231 -0.064 0.448 ± 0.143 -0.064 bn100413732 7+8+11 179.651 ± 2.817 -0.512 96.258 ± 2.445 34.688 bn100414097 6+7+9+11 26.497 ± 2.073 1.856 13.248 ± 0.272 8.192 bn100417166 6+7+9 0.192 ± 0.091 -0.064 0.128 ± 0.091 -0.064 bn100417789 2+10 52.545 ± 1.856 -2.560 15.552 ± 0.604 0.192 bn100420008 3+4+5 20.288 ± 0.405 0.192 8.704 ± 0.231 1.920 bn100421917 1+2 47.489 ± 10.849 -22.272 16.960 ± 1.494 1.216

– 109 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn100423244 3+4+6+7 16.512 ± 2.226 1.600 6.976 ± 0.362 5.312 bn100424729 7+8+11 175.107 ± 1.493 -25.345 83.201 ± 1.717 15.872 bn100424876 0+1+5 169.987 ± 3.557 -2.048 20.480 ± 2.290 131.074 bn100427356 0+3+6+7 12.544 ± 7.389 -4.864 4.544 ± 0.630 0.640 bn100429999 6+7+9 25.024 ± 6.582 -12.800 6.656 ± 0.547 -0.512 bn100502356 3+4+7+8 95.810 ± 2.382 -2.816 53.633 ± 1.118 12.224 bn100503554 3+4+6+7+8 129.602 ± 10.230 6.592 35.009 ± 13.785 33.409 bn100504806 11 16.512 ± 1.810 1.216 8.320 ± 1.834 4.672 bn100506653 3+4+5 21.376 ± 1.891 -7.936 6.976 ± 0.800 0.192 bn100507577 9+10+11 44.033 ± 5.221 -1.024 14.336 ± 1.448 5.120 bn100510810 4 31.169 ± 4.017 -3.328 10.368 ± 0.975 0.640 bn100511035 3+6+7 42.433 ± 1.478 0.832 9.408 ± 0.091 17.856 bn100513879 4+6+7+8 11.136 ± 1.145 -0.768 3.456 ± 0.286 2.176 bn100515467 6+7+8+11 10.624 ± 1.431 -0.640 1.920 ± 0.231 0.704 bn100516369 6+7+8+11 2.112 ± 1.134 -1.920 1.024 ± 0.771 -1.024 bn100516396 6+7+8+11 0.640 ± 0.487 -0.576 0.128 ± 0.143 -0.192 bn100517072 0+1+2+9+10 55.808 ± 1.810 0.000 36.352 ± 0.572 1.280 bn100517132 3+6+7 19.840 ± 3.620 -0.512 9.856 ± 1.708 0.640 bn100517154 7+8+11 30.464 ± 0.810 -0.256 24.576 ± 0.572 0.256 bn100517243 1+2+3+5 29.632 ± 4.482 -13.568 10.816 ± 0.889 -6.656 bn100517639 3+4+7 5.440 ± 0.604 -0.768 2.816 ± 0.231 0.960 bn100519204 3+6+7+8 62.913 ± 3.929 0.640 24.960 ± 0.680 8.768 bn100522157 1+2+3+5 35.326 ± 0.715 0.003 11.712 ± 1.541 0.768 bn100525744 9+10 1.472 ± 1.974 -0.384 0.576 ± 0.462 -0.128 bn100527795 9+10+11 184.579 ± 3.238 -92.674 51.905 ± 2.010 12.864 bn100528075 6+7+9 22.464 ± 0.749 -0.256 7.040 ± 0.091 5.056 bn100530737 9+10+11 3.328 ± 0.810 -1.024 2.048 ± 0.572 -0.512 bn100604287 0+1+2+9+10 13.440 ± 0.871 -2.304 3.968 ± 0.231 1.920 bn100605774 6+7+9 8.192 ± 2.862 -1.024 3.072 ± 0.810 -0.256 bn100608382 3+6+7 30.208 ± 1.619 -7.680 14.848 ± 1.619 -2.304 bn100609783 3+4+5 230.404 ± 8.689 6.144 64.513 ± 22.737 32.769 bn100612545 2+5 0.576 ± 0.181 0.000 0.320 ± 0.143 0.064 bn100612726 3+4+7+8 8.576 ± 3.210 0.704 2.624 ± 0.286 2.432 bn100614498 6+7+9+10+11 172.291 ± 12.447 -149.763 72.193 ± 5.346 -74.497 bn100615083 6+7+8 37.377 ± 0.979 0.320 26.368 ± 0.689 2.944 bn100616773 10+11 0.192 ± 0.143 -0.192 0.128 ± 0.091 -0.192 bn100619015 2+5 96.002 ± 1.319 0.384 80.642 ± 0.231 7.744

– 110 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn100620119 6+7 51.841 ± 8.518 0.192 11.520 ± 0.861 3.008 bn100621452 1+3+4+5 123.906 ± 5.515 -6.656 89.601 ± 3.238 1.536 bn100621529 0+1+2+9+10 1.024 ± 0.202 -0.448 0.384 ± 0.143 -0.192 bn100625773 4 0.192 ± 0.143 -0.064 0.064 ± 0.143 0.000 bn100625891 3+6+7+8 29.184 ± 1.086 -7.424 18.432 ± 0.923 0.512 bn100629801 10+11 0.832 ± 0.373 -0.128 0.320 ± 0.143 0.000 bn100701490 4+5 22.016 ± 5.568 0.096 4.992 ± 0.264 3.552 bn100704149 0+1+2 214.404 ± 5.917 -38.145 11.648 ± 1.231 1.344 bn100706693 8+9+10+11 0.128 ± 0.143 -0.128 0.064 ± 0.091 -0.064 bn100707032 7+8 81.793 ± 1.218 1.088 20.672 ± 0.345 3.712 bn100709602 4+5 100.098 ± 1.527 -2.560 61.505 ± 0.724 3.584 bn100713980 1+3+4+5 7.616 ± 0.529 -0.384 1.472 ± 0.407 -0.128 bn100714672 2 35.584 ± 5.126 -0.512 15.360 ± 1.379 4.352 bn100714686 2+10 5.632 ± 2.064 -3.328 1.280 ± 0.572 -0.256 bn100715477 6+7+8+9 14.848 ± 3.665 -1.024 5.632 ± 2.172 1.536 bn100717372 8+11 5.952 ± 1.507 -0.576 0.832 ± 0.286 3.264 bn100717446 6+7+8+11 2.432 ± 1.356 -0.128 0.768 ± 0.231 0.000 bn100718160 0+1+2+5 32.640 ± 1.864 -21.616 8.576 ± 1.379 -4.208 bn100718796 9+10+11 38.656 ± 8.002 -2.816 12.544 ± 1.280 1.024 bn100719311 0+1+2 1.600 ± 0.854 -1.536 0.512 ± 0.286 -0.640 bn100719825 9+10 3.072 ± 3.114 -2.304 1.280 ± 0.724 -1.024 bn100719989 3+4+5 21.824 ± 1.305 1.536 3.328 ± 0.580 2.624 bn100722096 0+1+3 7.165 ± 1.055 0.003 2.560 ± 0.362 0.768 bn100722291 4+8 1.280 ± 0.905 -1.216 0.384 ± 0.916 -0.384 bn100724029 0+1+2+3+5 114.690 ± 3.238 8.192 47.105 ± 2.290 26.624 bn100725475 6+7+9 146.434 ± 4.971 -2.048 124.930 ± 3.692 6.144 bn100727238 3+4+5 23.808 ± 2.769 -6.656 10.240 ± 1.950 -3.328 bn100728095 0+1+2+5 165.378 ± 2.896 13.312 61.953 ± 1.448 61.441 bn100728439 6+7+8+11 10.240 ± 1.846 -2.048 3.584 ± 0.572 0.256 bn100730463 9+10+11 63.873 ± 8.776 -1.536 33.409 ± 9.026 16.960 bn100802240 3+4+6+7+8 28.672 ± 3.167 -1.792 11.008 ± 1.619 0.512 bn100804104 3+4+6+7+8 6.592 ± 0.771 0.128 3.456 ± 0.286 1.280 bn100805300^b 7+8+10 0.064 ± 0.072 -0.096 0.064 ± 0.045 -0.096 bn100805845 0+1+5 58.430 ± 6.426 0.003 30.721 ± 2.111 2.368 bn100810049 3+4+5 2.560 ± 1.741 -1.856 1.152 ± 0.659 -1.280 bn100811108 6+7+8+9+10+11 0.384 ± 0.091 -0.064 0.256 ± 0.091 0.000 bn100811781 0+1+3 78.080 ± 3.840 -52.992 48.384 ± 1.619 -40.448

– 111 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn100814160 7+8+11 150.530 ± 1.619 0.576 72.193 ± 1.619 5.696 bn100814351 1+2+5 7.424 ± 0.923 -0.768 3.072 ± 0.724 0.768 bn100816009 4+8 62.401 ± 5.278 -21.760 22.720 ± 0.923 -2.560 bn100816026 7+8+11 2.045 ± 0.229 0.003 0.896 ± 0.143 0.512 bn100819498 9+10+11 12.544 ± 1.810 -4.864 5.376 ± 0.680 -1.280 bn100820373 0+1+2+9+10 8.960 ± 2.187 -0.768 1.792 ± 0.572 0.000 bn100825287 2+10 3.328 ± 1.846 -1.280 1.536 ± 0.362 -0.512 bn100826957 6+7+8+11 84.993 ± 0.724 8.704 47.105 ± 0.572 19.456 bn100827455 3+6+7+8 0.576 ± 0.389 -0.128 0.128 ± 0.389 0.320 bn100829374 1+2+5 94.977 ± 2.767 0.256 11.520 ± 1.086 56.065 bn100829876 2+10 8.704 ± 0.389 0.096 1.344 ± 0.143 0.672 bn100831651 4+5 40.193 ± 11.986 -23.296 18.944 ± 2.636 -11.264 bn100902990 6+7+8 22.272 ± 3.338 -4.096 8.704 ± 1.305 -0.512 bn100905907 3+4 11.520 ± 1.145 -4.608 3.584 ± 0.572 -0.256 bn100906576 7+8+11 110.594 ± 2.828 0.768 18.944 ± 1.305 5.120 bn100907751 1+2+5 5.376 ± 2.187 -1.536 1.536 ± 0.923 -0.512 bn100910818 0+1+2+3+5 13.824 ± 0.724 1.344 6.656 ± 0.572 5.184 bn100911816 0+1+3+4+5 5.632 ± 1.999 -0.768 2.304 ± 0.724 -0.256 bn100915243 2+5 7.936 ± 3.367 -7.424 2.304 ± 1.619 -2.816 bn100916779 2+4+5 12.800 ± 2.111 -0.256 10.240 ± 0.810 -0.256 bn100918863 8+11 86.017 ± 8.689 18.432 49.153 ± 8.689 36.865 bn100919884 0+1+2+3+5 49.601 ± 2.975 -38.401 16.128 ± 2.073 -8.448 bn100922625 9+10+11 4.352 ± 0.923 -1.024 3.072 ± 0.724 -0.768 bn100923844 0+1 51.713 ± 5.838 -0.768 9.984 ± 0.923 21.248 bn100924165^e 6+7+9+10+11 9.024 ± 0.362 -0.640 3.776 ± 0.231 0.512 bn100926595 4+8 32.256 ± 0.572 -24.064 13.568 ± 0.572 -11.776 bn100926694 6+7+8+9+11 37.888 ± 2.611 -3.072 28.416 ± 3.415 -0.512 bn100929235 0+1+2+3+5 8.192 ± 2.360 -2.304 3.072 ± 0.923 -1.280 bn100929315 4+5 4.608 ± 1.305 -0.512 1.536 ± 0.724 -0.512 bn100929916 2+5 0.320 ± 0.143 -0.128 0.256 ± 0.143 -0.064 bn101002279 9+10+11 7.168 ± 2.290 -4.352 5.632 ± 1.086 -3.840 bn101003244 3+4+5 9.984 ± 1.448 -1.792 3.840 ± 0.572 0.000 bn101004426 1+2 161.027 ± 7.836 -141.058 93.698 ± 2.673 -94.466 bn101008697 6+7+8+11 8.960 ± 1.846 -2.560 3.072 ± 1.557 -1.024 bn101010190 9+10+11 65.025 ± 6.165 -11.008 49.665 ± 1.086 -1.280 bn101011707 6+8+10+11 36.352 ± 2.318 -1.024 22.528 ± 1.717 1.792 bn101013412 0+1+2+9 15.360 ± 0.572 0.576 7.680 ± 0.272 2.304

– 112 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn101014175 6+7+8+11 449.415 ± 1.410 1.408 200.131 ± 1.002 13.632 bn101015558 6+7+8+11 500.552 ± 7.408 -2.048 197.059 ± 0.996 61.761 bn101016243 3+4+6+7+8 3.840 ± 0.362 -1.536 1.280 ± 0.362 -0.256 bn101017619 6+7+8+9 47.872 ± 1.950 -1.024 20.224 ± 2.360 2.560 bn101021009 11 120.770 ± 12.237 -51.457 40.065 ± 0.861 4.032 bn101021063 7+8+9+11 1.536 ± 2.360 -0.512 0.768 ± 0.362 -0.512 bn101023951 2+5 76.801 ± 8.256 9.216 9.216 ± 1.448 61.441 bn101024486 4+5 20.224 ± 2.828 -3.840 13.824 ± 4.128 -1.024 bn101025146 0+1+2+5 14.336 ± 1.846 -1.792 6.400 ± 0.923 -1.280 bn101026034 2+5 0.256 ± 0.091 -0.128 0.192 ± 0.143 -0.128 bn101027230 3+6+7 1.344 ± 1.802 -1.280 0.128 ± 0.091 -0.064 bn101030664 1+2+5 95.746 ± 4.375 -69.633 65.537 ± 0.923 -57.601 bn101031625 2+4+5 0.384 ± 0.462 -0.064 0.192 ± 0.143 -0.064 bn101101744 7+8+11 3.328 ± 2.862 -2.304 1.024 ± 0.572 -0.768 bn101101899 3+4+5 31.232 ± 1.619 -4.608 13.824 ± 1.145 0.512 bn101102840 6+7+9+11 43.520 ± 6.676 -1.792 19.200 ± 3.367 2.048 bn101104810 0+2+4+5 1.280 ± 0.572 -0.512 0.768 ± 0.572 0.000 bn101107011 0+3 375.814 ± 8.444 2.304 332.805 ± 3.692 10.496 bn101112924 2+5 9.472 ± 2.996 -5.888 1.792 ± 0.572 -0.256 bn101112984 6+7 82.944 ± 1.717 -9.472 55.808 ± 1.086 1.792 bn101113483 6+7+9+10+11 12.288 ± 0.572 -0.256 6.912 ± 0.572 1.536 bn101116481 2+3 0.576 ± 0.820 -0.128 0.384 ± 0.373 -0.128 bn101117496 7+8+11 50.177 ± 1.639 -2.048 24.064 ± 1.086 11.776 bn101119685 1+2+10 0.640 ± 0.607 -0.320 0.192 ± 0.231 -0.192 bn101123952 9+10 103.938 ± 0.724 41.473 30.465 ± 1.557 46.849 bn101126198 6+7+8+11 43.837 ± 1.747 0.004 9.216 ± 0.320 9.792 bn101127093 3+4+5 29.440 ± 4.471 -3.328 22.016 ± 1.145 -2.048 bn101127102 6+7+9 60.672 ± 7.322 -5.120 20.224 ± 0.724 3.584 bn101128322 6+7+9 8.192 ± 1.493 -2.816 2.816 ± 0.572 -1.280 bn101129652 2+6+9 0.384 ± 0.143 -0.064 0.192 ± 0.181 0.064 bn101129726 0+1+2+3 0.576 ± 0.143 -0.064 0.256 ± 0.091 0.000 bn101130074 4+5 4.864 ± 2.769 -2.304 2.304 ± 2.415 -1.536 bn101201418 1+2+9+10 112.639 ± 7.455 0.003 35.841 ± 2.896 15.360 bn101202154 10+11 18.432 ± 3.665 0.000 9.984 ± 1.846 2.816 bn101204343 0+3+4+5+6 0.128 ± 0.091 -0.064 0.128 ± 0.091 -0.064 bn101205309 1+2+5 7.936 ± 5.938 -3.840 3.072 ± 1.619 -2.816 bn101206036 0+1+2+9+10 34.813 ± 5.837 0.003 11.200 ± 1.652 4.544

– 113 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn101207536 3+4+5 61.441 ± 3.727 5.632 34.817 ± 0.572 11.520 bn101208203 3+5 0.192 ± 1.478 -0.192 0.192 ± 0.143 -0.192 bn101208498 1+2+5 2.048 ± 0.951 -0.640 0.384 ± 0.181 0.256 bn101211485 7+8+11 13.568 ± 7.030 -2.816 4.352 ± 0.724 -1.024 bn101213451 2+5 45.057 ± 1.950 0.256 17.408 ± 1.280 6.144 bn101213849 0+1+3+5 6.656 ± 1.145 -1.792 2.048 ± 0.572 -0.256 bn101214748 2+10 2.240 ± 2.084 -1.408 0.128 ± 0.202 -0.064 bn101214993 3+4+6+7+8 11.520 ± 3.665 -0.768 5.373 ± 2.360 0.003 bn101216721 1+2+5 1.917 ± 0.551 0.003 0.512 ± 0.143 0.320 bn101219686 3+4+6+7+8 51.009 ± 1.775 -4.352 21.824 ± 2.199 2.624 bn101220576 0 72.449 ± 4.048 2.304 22.528 ± 0.923 16.128 bn101220864 3+4+6+7+8 31.745 ± 2.187 -1.024 17.408 ± 2.896 7.168 bn101223834 2+3+4 56.065 ± 5.497 -41.217 13.824 ± 1.280 -5.632 bn101224227 3+4+5 1.728 ± 1.680 -0.064 0.192 ± 0.286 0.000 bn101224578 0+1+2+3+5 44.737 ± 0.889 -0.128 32.257 ± 0.810 3.136 bn101224614 1+2+5 25.601 ± 3.416 -2.560 8.448 ± 1.280 2.048 bn101224998 3+4+5 18.688 ± 8.719 -9.728 7.424 ± 0.362 -1.280 bn101225377 7+8+11 81.217 ± 35.377 20.544 12.352 ± 0.453 81.794 bn101227195 4+8 95.488 ± 1.639 -0.768 86.784 ± 3.665 2.048 bn101227406 0+3+6+9 153.347 ± 2.573 0.768 39.681 ± 0.923 3.840 bn101227536 6+7+8+11 28.865 ± 3.088 -0.128 10.496 ± 0.362 0.832 bn101231067 2+9+10 23.614 ± 0.572 0.003 16.640 ± 0.724 3.904 bn110101202 1+3+4+5 3.584 ± 1.493 -2.304 1.024 ± 1.086 -0.768 bn110101506 6+7 235.523 ± 8.256 -103.425 158.722 ± 8.749 -64.513 bn110102788 0+1+9 253.956 ± 2.049 -119.426 73.921 ± 0.429 7.488 bn110105877 9+10+11 123.394 ± 6.476 -7.680 72.705 ± 3.238 8.192 bn110106893 10+11 35.521 ± 3.612 -16.896 11.648 ± 0.604 -1.024 bn110107886 0+1+2+3 183.555 ± 24.406 -61.185 81.665 ± 11.801 -32.257 bn110108977 1+2 51.456 ± 6.955 -1.024 25.856 ± 1.950 4.608 bn110112934 1+9+10 2.304 ± 2.538 -0.960 0.320 ± 0.326 -0.064 bn110117364 8+10 72.448 ± 9.051 -1.792 41.472 ± 4.404 4.864 bn110117626 6+7+9+10+11 43.264 ± 1.639 -2.048 24.576 ± 0.362 0.768 bn110118857 0+1+2+9 34.561 ± 2.360 -6.144 4.096 ± 0.810 0.256 bn110119931 3+4+5 205.828 ± 1.864 -0.768 44.033 ± 0.923 15.616 bn110120666 6+7+9 28.417 ± 9.793 0.256 9.792 ± 1.159 1.792 bn110123804 0+1+3+4+5 17.856 ± 0.810 0.704 8.064 ± 0.181 5.056 bn110124784 3+6+7 5.376 ± 2.202 -3.328 1.792 ± 0.923 -1.280

– 114 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn110125894 0+1+3 4.800 ± 0.923 -0.768 1.856 ± 0.640 -0.256 bn110128073 6+7+9 12.160 ± 4.971 -5.824 4.608 ± 2.470 -2.560 bn110130230 6+7+8+11 47.360 ± 2.187 -0.256 32.000 ± 1.280 4.864 bn110131780 0+1+9 0.384 ± 1.478 -0.192 0.192 ± 0.264 -0.128 bn110201399 4 8.192 ± 0.870 -1.792 3.968 ± 1.421 -0.512 bn110204179 3+4 28.673 ± 6.720 -3.840 5.888 ± 1.280 1.536 bn110205027 4+8 6.400 ± 3.238 -2.816 2.304 ± 3.114 -1.024 bn110205588 5 158.720 ± 2.290 -7.168 138.240 ± 2.896 5.120 bn110206202 2+5 12.288 ± 1.639 -6.400 4.864 ± 0.810 -5.120 bn110207470 3+4+5 37.888 ± 2.290 -1.024 20.480 ± 1.448 11.264 bn110207959 4+8 7.680 ± 4.944 -0.768 3.328 ± 2.611 -0.512 bn110209165 2+5 5.632 ± 0.916 -3.776 2.432 ± 0.640 -3.328 bn110212550^g 6+7+8+11 0.064 ± 0.036 -0.048 0.032 ± 0.023 -0.032 bn110213220 3+4 34.305 ± 1.639 -0.768 6.400 ± 0.572 14.592 bn110213876 0+1+2+3+4+5 0.320 ± 0.810 -0.128 0.256 ± 0.231 -0.128 bn110217591 0+1+2+9+10 60.672 ± 11.611 -3.328 30.464 ± 4.720 1.536 bn110220761 6+7+9+10+11 33.024 ± 8.738 -1.792 17.408 ± 2.111 -0.256 bn110221244 0+6+9 13.056 ± 1.846 -1.536 4.096 ± 0.572 1.536 bn110226989 9+10+11 14.080 ± 0.923 -2.304 6.400 ± 0.724 0.256 bn110227009 6+7+8+10 1.728 ± 0.653 -0.192 0.768 ± 0.264 -0.128 bn110227229 0+1+6 18.432 ± 2.187 -1.024 8.192 ± 2.290 1.024 bn110227420 9+10+11 25.600 ± 6.869 -11.264 6.141 ± 1.446 0.003 bn110228011 2+5 44.481 ± 2.834 -30.721 7.680 ± 0.792 -1.280 bn110228792 3+4+6+7+8 17.152 ± 2.360 -3.840 9.472 ± 1.448 -0.512 bn110301214 7+8+11 5.693 ± 0.362 0.003 2.304 ± 0.362 1.600 bn110302043 6+7+8 38.336 ± 2.509 -11.200 11.392 ± 1.105 -1.216 bn110304071 2+5 19.520 ± 1.498 -0.256 14.848 ± 0.854 0.832 bn110307972 6+7+9+10+11 2.304 ± 3.444 -1.792 0.768 ± 0.572 -0.512 bn110311812 9+10+11 6.400 ± 1.639 -1.792 2.816 ± 0.362 -0.256 bn110316139 0+3+4+6+7 2.944 ± 2.199 -3.008 1.280 ± 1.802 -1.344 bn110318552 0+1+2+5 14.464 ± 1.094 -2.560 4.096 ± 0.231 3.840 bn110319628 9+10 15.336 ± 1.446 -2.300 7.924 ± 0.922 1.278 bn110319815 2+4+5 31.232 ± 5.049 -2.560 15.360 ± 3.367 0.256 bn110321346^k 0+1+2+5 30.720 ± 10.764 -4.096 11.264 ± 2.187 -1.280 bn110322558 0+1+3+6+7 36.097 ± 1.846 -4.096 23.296 ± 0.923 2.560 bn110328520 6+7+9 141.315 ± 29.767 1.024 33.793 ± 3.238 6.144 bn110331604 1+2+5 3.200 ± 0.951 -0.064 1.152 ± 0.634 0.320

– 115 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn110401920 2+9+10 2.368 ± 1.270 -0.640 0.640 ± 0.143 -0.064 bn110402009 2+10 35.649 ± 1.461 1.152 21.952 ± 1.223 3.072 bn110407998 3+4+6+7+8 9.024 ± 0.091 0.832 3.840 ± 0.143 2.752 bn110409179 6+7+8+9+10+11 0.128 ± 0.143 -0.128 0.128 ± 0.091 -0.128 bn110410133 0+1+3+4+5 61.952 ± 1.379 -11.008 32.256 ± 0.572 1.024 bn110410772 0+1+3 8.064 ± 1.368 -4.736 3.840 ± 0.453 -3.136 bn110411629 7+8 23.552 ± 1.950 -3.840 12.800 ± 0.810 -0.768 bn110412315 6+7+9+11 20.733 ± 4.636 0.003 6.912 ± 0.724 2.560 bn110413938 3+4+5 54.272 ± 2.172 -2.816 20.736 ± 2.996 12.800 bn110415541 8+11 166.146 ± 0.810 0.256 154.370 ± 6.197 5.120 bn110420946 2+5 0.128 ± 0.516 -0.064 0.064 ± 0.143 -0.064 bn110421757 3+4+6+7+8 40.449 ± 0.923 -2.560 12.032 ± 0.572 5.120 bn110422029 6+7+8+11 0.320 ± 0.453 -0.128 0.256 ± 0.181 -0.128 bn110424758^b 0+1+2+5 0.672 ± 1.120 -0.064 0.128 ± 0.385 -0.064 bn110426629 8+9+10+11 356.357 ± 4.345 14.592 105.729 ± 3.167 157.442 bn110428338 3+4+7+8 101.634 ± 2.919 -53.761 59.137 ± 1.280 -30.977 bn110428388 0+3+4+6+7 5.632 ± 0.181 2.688 3.328 ± 0.091 3.904 bn110430375 6+7+9 32.513 ± 1.717 1.024 13.824 ± 0.724 8.704 bn110503145 1+3+4+5 7.936 ± 1.145 -0.256 3.584 ± 0.572 1.280 bn110505203 0+1+6+9 4.096 ± 0.545 -0.384 1.600 ± 0.231 0.320 bn110509142 9+10 68.864 ± 2.757 -11.008 20.992 ± 4.104 -1.536 bn110509475 0+1+2+3+5 0.640 ± 0.779 -0.320 0.384 ± 0.143 -0.064 bn110511616 6+7+9 5.888 ± 1.639 -2.560 2.560 ± 1.086 -1.792 bn110517453 0+1+3+9 0.576 ± 1.810 -0.064 0.128 ± 0.405 0.000 bn110517573 6+7+8+11 23.040 ± 0.362 -0.256 16.384 ± 0.572 2.048 bn110517902^l 6+7+8+11 23.040 ± 0.362 -0.256 16.384 ± 0.572 2.048 bn110520302 9+10 12.288 ± 11.337 -10.496 5.376 ± 0.923 -5.888 bn110521478 2 6.141 ± 0.809 0.003 1.792 ± 0.572 0.512 bn110522256 9+10 28.160 ± 2.673 -8.704 10.752 ± 1.056 0.256 bn110522296 0+1+3 27.136 ± 1.950 -5.120 6.656 ± 0.724 -0.512 bn110522633 3+4+6+7+8 58.112 ± 2.828 -0.256 20.736 ± 0.572 0.256 bn110523344 9+10+11 44.544 ± 2.611 -1.280 18.176 ± 5.655 0.512 bn110526715 3+4 0.448 ± 0.528 -0.128 0.320 ± 0.143 -0.064 bn110528624 3+4+5 69.633 ± 5.526 -1.024 37.120 ± 1.846 8.448 bn110529034 6+7+9+10 0.512 ± 0.091 -0.128 0.256 ± 0.091 -0.064 bn110529262 4+7+8 45.825 ± 1.810 0.256 18.432 ± 0.572 2.816 bn110529811 0+1+2+3+5 34.817 ± 4.636 -2.560 14.080 ± 0.923 1.536

– 116 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn110531448 6+7+9+11 38.656 ± 2.360 -4.864 14.592 ± 1.145 -0.768 bn110601681 0+1+2+9+10 52.206 ± 13.350 0.003 21.504 ± 2.290 4.080 bn110605183 1+2+5 82.689 ± 3.083 1.536 24.064 ± 0.572 4.864 bn110605780 9+10+11 1.536 ± 1.056 -0.256 0.768 ± 0.572 0.000 bn110609185 9+10+11 9.984 ± 4.471 -3.328 2.816 ± 1.280 -1.280 bn110609425 0+1+2+9 33.024 ± 2.896 -6.656 15.360 ± 1.280 0.512 bn110610640 0+1+2+9+10 43.521 ± 2.862 -5.632 30.720 ± 1.056 4.096 bn110613631 1+2+9+10 40.193 ± 3.874 -0.256 20.480 ± 1.145 6.144 bn110616648 8+11 12.544 ± 2.611 -4.608 4.864 ± 1.493 -1.280 bn110618366 2+10 163.843 ± 11.406 -3.072 51.201 ± 2.290 16.384 bn110618760 0+1+2 89.601 ± 4.291 -0.512 22.528 ± 0.923 7.680 bn110622158 3+4+5 70.401 ± 0.773 6.080 22.976 ± 0.286 18.688 bn110624906 3+4+5 3.520 ± 4.948 -1.280 1.664 ± 0.590 -0.896 bn110625579 9+10+11 35.584 ± 1.846 -0.512 9.984 ± 0.724 3.840 bn110625881 7+8+11 26.881 ± 0.572 3.840 14.080 ± 0.362 11.264 bn110626448 1+2+5 6.400 ± 1.145 -0.768 2.048 ± 0.724 0.256 bn110629174 0+1+2+5 61.694 ± 18.690 0.003 36.609 ± 1.056 1.024 bn110702187 8+11 34.369 ± 5.736 -10.752 16.384 ± 0.640 -0.512 bn110703557 3+6+7+8 6.720 ± 1.619 -4.224 1.344 ± 0.232 -0.384 bn110705151^g 3+4+5 0.192 ± 0.036 -0.016 0.128 ± 0.023 0.016 bn110705364 0+1+2+3+4+5 19.200 ± 0.923 0.256 10.752 ± 0.572 4.608 bn110706202 0+1+2+3+4+5 12.032 ± 4.382 -1.536 5.888 ± 2.828 1.024 bn110706477 6+7+9 73.217 ± 14.612 -2.560 16.640 ± 0.923 3.840 bn110706728 6+7+9 16.896 ± 6.339 0.128 10.752 ± 0.286 1.600 bn110706977 6+7+8 33.216 ± 4.007 -14.720 6.912 ± 0.362 0.320 bn110709463 0+1 24.061 ± 0.722 0.003 15.360 ± 0.362 2.560 bn110709642 9+10 43.201 ± 0.405 1.088 19.648 ± 0.231 6.464 bn110709862 1+2+10 5.376 ± 1.493 -1.792 2.304 ± 0.572 -0.768 bn110710954 0+1 22.720 ± 1.604 -4.864 9.856 ± 0.202 1.216 bn110716018 7+8 7.168 ± 1.747 -3.072 1.024 ± 0.320 -0.512 bn110717180^g 8+11 0.112 ± 0.072 -0.016 0.032 ± 0.023 0.000 bn110717319 7+8+11 90.369 ± 0.810 5.376 25.344 ± 0.572 12.032 bn110720177 0+1+3+4+5 11.200 ± 0.602 -0.128 4.352 ± 0.362 1.344 bn110721200 6+7+9+11 21.822 ± 0.572 0.003 5.376 ± 0.572 1.344 bn110722694 3+4+5 73.473 ± 11.404 -0.512 22.336 ± 1.484 12.992 bn110722710 1+2+10 14.336 ± 2.721 -4.608 4.348 ± 0.920 0.004 bn110725236 6+7+8+11 20.224 ± 1.056 -1.024 17.408 ± 0.724 -0.256

– 117 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn110726211 7+8+11 29.952 ± 10.608 -3.840 13.312 ± 0.923 2.304 bn110728056 0+1+9 0.704 ± 0.231 -0.128 0.576 ± 0.320 -0.064 bn110729142 6+7+8 408.582 ± 2.290 2.080 354.310 ± 2.290 22.560 bn110730008 0+3+4 28.416 ± 2.919 -7.936 11.520 ± 2.429 -3.328 bn110730660 9+11 33.856 ± 1.811 -8.704 14.656 ± 0.572 0.512 bn110731465 0+1+3+6+9 7.485 ± 0.572 0.003 4.352 ± 0.362 1.344 bn110801335 8+11 0.384 ± 0.326 -0.128 0.192 ± 0.181 -0.064 bn110803783 6+7+9+11 186.883 ± 2.986 -156.675 153.091 ± 3.727 -142.338 bn110806934 0+1+2+3+5 28.416 ± 0.923 0.256 13.824 ± 0.362 6.144 bn110809461 0+3 12.544 ± 4.615 -4.352 2.816 ± 0.724 0.768 bn110812899 0+1+3 11.264 ± 3.727 -2.304 3.072 ± 0.572 -0.256 bn110813237 3+6+7+9 22.784 ± 3.114 -1.792 4.608 ± 0.810 1.280 bn110817191^e 6+7+9+11 5.949 ± 0.572 0.003 2.048 ± 0.362 0.832 bn110818860 7+8+11 67.073 ± 3.916 -9.984 28.928 ± 1.379 1.792 bn110819665 8 16.384 ± 6.149 -0.512 2.560 ± 1.145 0.000 bn110820476 0+1+2 11.264 ± 7.331 -4.096 2.816 ± 1.493 -1.792 bn110824009 0+1+2+3+4+5 76.607 ± 9.220 0.003 22.016 ± 5.910 0.832 bn110825102 3+4+6+7+8 62.465 ± 0.231 11.648 4.608 ± 0.091 13.184 bn110825265 6+7+8+9 51.073 ± 3.389 -16.384 26.048 ± 1.175 -6.912 bn110828575 0+1+3+7+9 44.673 ± 7.534 -1.120 12.288 ± 2.064 1.824 bn110831282 9+10+11 98.881 ± 3.138 -20.224 35.965 ± 1.104 0.003 bn110901230 0+1+5 22.528 ± 5.620 -7.680 8.960 ± 3.114 -3.584 bn110903009 2+5 28.672 ± 2.429 -1.024 20.480 ± 0.572 1.792 bn110903111 0+1+3+4+5 341.254 ± 2.288 -0.256 203.779 ± 2.290 11.264 bn110904124 9+10 83.905 ± 3.853 -0.128 14.848 ± 0.724 38.977 bn110904163 0+1+2+5 51.457 ± 4.128 -1.280 7.424 ± 0.362 9.216 bn110904531 9+10+11 20.480 ± 5.479 -2.560 8.192 ± 0.923 -0.512 bn110906302 7+8+11 23.936 ± 2.550 -5.376 6.016 ± 0.286 0.384 bn110909116^m 7+9 20.736 ± 1.639 -12.288 6.400 ± 0.724 -1.280 bn110911071 10 8.960 ± 4.352 -4.608 3.840 ± 2.429 -1.536 bn110916016 9+10+11 1.792 ± 1.993 -1.408 0.704 ± 0.551 -0.768 bn110919634 4+7+8 35.073 ± 3.974 10.496 12.032 ± 0.810 23.296 bn110920338 6+7+9 9.728 ± 0.810 -0.512 3.584 ± 0.362 0.000 bn110920546 0+1+3 160.771 ± 5.221 5.120 58.369 ± 2.290 18.432 bn110921444 6+7+8+9+11 149.507 ± 10.691 -68.609 83.969 ± 23.641 -37.889 bn110921577 2+9+10 40.705 ± 1.810 -30.209 17.920 ± 1.379 -15.104 bn110921912 1+9 17.664 ± 0.345 0.896 5.376 ± 0.143 2.624

– 118 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn110923835 9+10+11 46.398 ± 11.279 0.003 12.800 ± 1.619 1.344 bn110926107 9+10+11 75.265 ± 1.280 -0.768 49.921 ± 0.487 13.440 bn110928180^n 0+1+3+4 148.226 ± 1.925 -119.298 15.424 ± 0.500 0.576 bn110929187 0+6+9+10 5.120 ± 0.572 -0.512 1.792 ± 0.362 0.000 bn110930564 4+5 37.889 ± 5.431 -6.912 15.616 ± 1.864 1.024 bn111001804 7+9+10+11 0.384 ± 1.361 -0.256 0.256 ± 0.286 -0.256 bn111003465 3+4+6+7+8 16.640 ± 1.056 0.512 7.168 ± 0.362 2.816 bn111005398 0+1+2+6+9+10 30.720 ± 3.093 -11.264 9.472 ± 0.724 -1.024 bn111008992 0+1+3+4+5 42.496 ± 4.128 -4.096 18.176 ± 0.923 2.304 bn111009282 0+1 20.736 ± 4.221 -0.256 6.144 ± 1.448 3.072 bn111010237 9+10 82.433 ± 8.444 -3.584 27.648 ± 2.896 6.144 bn111010660 1+2+3+4+5 8.704 ± 2.111 -1.024 4.864 ± 0.724 -0.512 bn111010709 6+7+9 52.993 ± 0.923 1.536 35.840 ± 0.572 7.680 bn111010899 6+7+9 18.560 ± 2.988 -14.656 3.328 ± 0.916 -2.112 bn111011094 6+7+8+9+11 1.472 ± 0.771 -0.064 0.192 ± 0.143 -0.064 bn111012456 2+5 20.736 ± 0.724 1.024 8.448 ± 0.572 4.608 bn111012811 3+4+6+7+8 7.936 ± 1.145 -0.512 3.072 ± 0.724 0.000 bn111015427 2+5 92.737 ± 3.319 -0.640 50.177 ± 1.361 12.800 bn111017657 1+6+7+8+9 11.072 ± 0.410 0.256 3.520 ± 0.181 3.648 bn111018595 2+9+10 8.192 ± 1.864 -0.768 3.584 ± 1.056 0.000 bn111018785 0+3+4 29.697 ± 1.810 -6.400 13.824 ± 1.280 -0.768 bn111022854 3+6+7 0.192 ± 0.707 -0.128 0.128 ± 0.091 -0.128 bn111024722 3+4+5 68.609 ± 2.896 -6.144 28.672 ± 6.229 6.144 bn111024896 7+8 1.792 ± 1.846 -0.256 1.024 ± 1.305 -0.256 bn111025078 0+1+3 51.712 ± 2.202 -0.512 31.488 ± 1.280 7.936 bn111103441 2+9+10 11.968 ± 6.426 -0.128 7.680 ± 0.724 0.576 bn111103948 4+5 0.320 ± 0.181 -0.064 0.192 ± 0.202 0.000 bn111105457 0+1+3 43.520 ± 0.572 -9.984 33.024 ± 3.415 -3.584 bn111107035 4+8 12.032 ± 0.923 -1.536 5.376 ± 1.086 0.512 bn111107076 6+9+10 77.185 ± 0.810 0.192 41.025 ± 0.410 5.504 bn111109453 1+2+9+10 4.864 ± 2.757 -2.560 1.792 ± 1.145 -0.512 bn111109873 8 9.664 ± 6.457 -4.608 3.200 ± 1.175 0.512 bn111112908 0+1+3+4+5 0.192 ± 0.091 -0.064 0.128 ± 0.091 -0.064 bn111113410 6+7+8+9+11 15.360 ± 1.639 -1.024 5.120 ± 1.145 1.792 bn111114233 0+3+4+6+7 22.016 ± 2.673 -1.536 9.216 ± 1.145 0.256 bn111117510 0+6+7+9 0.576 ± 0.143 -0.128 0.320 ± 0.091 0.000 bn111117526 0+1+6+9+10 23.808 ± 1.717 -1.280 13.824 ± 0.923 2.560

– 119 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn111120556 1+2+10 98.626 ± 2.970 -21.248 17.408 ± 1.448 -8.192 bn111124308 6+7+8+11 8.960 ± 3.114 -0.768 3.072 ± 0.923 0.256 bn111127810 9+10 19.008 ± 2.548 -0.768 4.352 ± 0.286 6.592 bn111201599 3+4+5 16.896 ± 3.974 -1.792 8.448 ± 1.846 0.768 bn111203054 6+7+9 55.553 ± 5.684 -44.545 14.080 ± 1.557 -7.424 bn111203609 0+1+3+5 22.016 ± 6.734 -2.816 9.984 ± 6.446 -1.280 bn111207512 0+1+6+9 0.768 ± 1.145 -0.896 0.512 ± 0.181 -0.768 bn111208353 0+1+3 40.961 ± 4.345 -4.096 11.264 ± 2.290 1.024 bn111216389 2+10 83.777 ± 0.500 2.304 34.561 ± 0.871 39.425 bn111220486 0+1+2+5 39.041 ± 5.101 -6.144 13.760 ± 0.231 6.144 bn111221739 2+10 27.136 ± 7.186 -0.512 12.288 ± 11.779 -0.256 bn111222619 8+11 0.320 ± 0.143 -0.064 0.256 ± 0.091 -0.064 bn111226795 0+1+2+9+10 74.753 ± 8.749 -6.144 22.528 ± 2.290 5.120 bn111228453 3+4+6+7 2.944 ± 0.979 0.096 1.280 ± 0.231 0.736 bn111228657 6+7+8 99.842 ± 2.111 -49.409 46.337 ± 0.724 1.024 bn111230683 10 28.160 ± 1.557 -12.800 8.192 ± 1.379 -2.048 bn111230819 0+1+6+9 12.736 ± 1.145 -0.640 9.216 ± 0.572 0.832 bn120101354^b 3+6+7+8 0.128 ± 0.072 -0.096 0.064 ± 0.091 -0.064 bn120102095 3+4+5 28.417 ± 8.204 -11.520 4.032 ± 0.231 3.200 bn120102416 1+2+5 20.224 ± 2.769 -10.240 4.096 ± 0.923 -0.256 bn120105584 0+1+3 22.528 ± 2.202 -8.192 6.400 ± 1.864 -3.584 bn120107384 3+4+6+7+8 23.040 ± 0.143 0.064 16.192 ± 0.231 2.432 bn120109824 1+2 38.656 ± 3.114 -2.048 17.152 ± 1.619 0.256 bn120111051 9+10+11 76.801 ± 5.515 -2.048 25.600 ± 4.580 5.120 bn120114433 0+1+6+7+9 2.752 ± 1.569 -0.128 1.408 ± 1.120 0.128 bn120114681 1+2+5 43.264 ± 5.804 -7.936 11.264 ± 0.810 -1.536 bn120118709 6+7 37.825 ± 12.586 -3.328 10.752 ± 1.145 1.472 bn120118898 6+7+8+11 17.152 ± 2.111 -0.512 12.800 ± 0.362 -0.256 bn120119170 9+10+11 55.297 ± 6.229 3.072 16.384 ± 1.448 11.264 bn120119229 0+1+3 41.728 ± 1.557 0.000 19.712 ± 1.056 2.304 bn120119354 3+6+7 16.384 ± 1.493 -7.936 5.632 ± 0.362 -0.768 bn120120432 6+7+9+11 32.256 ± 6.481 0.000 13.312 ± 1.717 3.328 bn120121101 0+1+2+3+5 18.432 ± 3.727 -3.328 6.144 ± 0.724 0.768 bn120121251 4+7+8 37.121 ± 11.876 -5.632 10.752 ± 0.572 7.168 bn120122300 7+8+11 16.701 ± 1.881 0.003 5.632 ± 0.923 2.112 bn120129312 3+4 1.280 ± 0.689 -0.640 0.384 ± 0.362 -0.512 bn120129580 7+8+11 3.072 ± 0.362 0.320 1.536 ± 0.362 1.088

– 120 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn120130699 8+10+11 27.777 ± 0.694 -0.640 13.184 ± 0.462 9.600 bn120130906 3+4+6+7+8 3.584 ± 1.379 -1.280 2.048 ± 0.572 -0.768 bn120130938 0+9 38.913 ± 7.455 -5.120 9.216 ± 2.290 4.096 bn120203812 2+5 10.240 ± 2.429 -4.864 2.560 ± 0.572 -2.048 bn120204054 0+1+3+5 49.089 ± 0.429 10.176 13.568 ± 0.143 32.129 bn120205285 3+4+5 0.576 ± 0.272 -0.576 0.320 ± 0.143 -0.448 bn120206949 7+8+11 9.472 ± 3.338 -0.256 1.024 ± 0.362 4.352 bn120210650 0+1+2+3+9 1.344 ± 0.264 -0.064 0.704 ± 0.181 0.000 bn120212353^b 1+6+9 0.864 ± 0.577 -0.832 0.480 ± 0.611 -0.544 bn120212383 0+3+4 9.216 ± 0.724 -2.048 3.584 ± 1.145 -1.024 bn120213606 6+7+8+11 13.824 ± 3.328 -3.072 4.352 ± 0.362 0.512 bn120217808 8+11 5.888 ± 2.862 -0.512 1.536 ± 0.572 0.000 bn120217904 1+2+5 2.624 ± 0.300 -0.224 0.384 ± 0.143 0.416 bn120218276 0+1+6+9+10 256.260 ± 5.221 -212.996 191.235 ± 1.999 -184.579 bn120219563 0+1+2+3 8.128 ± 0.429 -1.152 4.544 ± 0.410 -0.128 bn120220210 0+1+9+10 21.248 ± 1.639 -5.376 9.216 ± 1.379 -1.792 bn120222021 1+3+4+5 1.088 ± 0.143 -0.064 0.512 ± 0.143 0.064 bn120222119 2+5 29.440 ± 5.382 -5.120 9.728 ± 1.846 -1.280 bn120223933 0+1+9+10 14.336 ± 2.360 -0.512 4.352 ± 0.724 0.512 bn120224282 9+10+11 60.929 ± 3.093 1.792 44.033 ± 1.379 11.776 bn120224898 0+1+3+5 29.184 ± 4.222 0.256 12.288 ± 1.086 3.840 bn120226447 8 14.592 ± 3.916 -3.264 4.864 ± 0.362 0.320 bn120226871 0+1+2 52.993 ± 0.572 4.352 23.040 ± 0.572 11.520 bn120227391 8+11 19.712 ± 1.717 -0.768 12.032 ± 0.572 3.840 bn120227725 8+11 17.408 ± 0.810 0.256 6.656 ± 0.572 5.632 bn120302080 8+11 80.384 ± 16.927 0.768 43.776 ± 2.521 8.960 bn120302722 4+5 1.600 ± 0.779 -0.128 0.512 ± 0.466 0.000 bn120304061 6+7+8+9+11 9.984 ± 1.055 -0.256 3.328 ± 0.362 0.512 bn120304248 4+5 5.376 ± 0.572 -0.256 3.072 ± 0.572 0.512 bn120308588 4+8 25.600 ± 1.557 -21.504 2.048 ± 0.362 -0.512 bn120312671 0+1+2+9+10 13.312 ± 3.167 -2.048 4.608 ± 0.923 -0.512 bn120314412 0+1+3 1.280 ± 1.086 -1.280 0.768 ± 0.923 -0.768 bn120316008 0+1+9 26.624 ± 0.362 1.536 11.264 ± 0.810 10.240 bn120319983 6+7+9 72.448 ± 7.832 -4.608 40.448 ± 3.114 1.536 bn120323162 9+10+11 4.352 ± 0.724 -0.768 1.536 ± 0.362 -0.256 bn120323507 0+1+3 0.448 ± 0.091 -0.064 0.192 ± 0.091 -0.064 bn120326056 0+1+2+3+5 11.776 ± 1.810 -1.280 4.096 ± 0.724 0.256

– 121 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn120327418 8+11 0.256 ± 1.319 -0.192 0.128 ± 1.032 -0.192 bn120328268 6+7+8+9+11 29.697 ± 1.056 3.840 14.848 ± 0.572 6.912 bn120331055 4+5 16.384 ± 10.367 -2.816 1.280 ± 3.328 2.560 bn120402669 10+11 20.224 ± 0.810 -2.080 2.524 ± 0.572 0.004 bn120403857 9+10 4.288 ± 1.935 -3.968 1.408 ± 1.620 -1.536 bn120410585 9+10+11 1.088 ± 1.180 -1.024 0.192 ± 0.143 -0.128 bn120411925 3+4+5 38.912 ± 1.493 0.000 35.072 ± 1.145 1.536 bn120412055 3+4+5 9.728 ± 3.566 -4.096 3.584 ± 1.717 -2.560 bn120412920 2+5 101.182 ± 4.871 0.003 11.264 ± 0.572 71.745 bn120415076^o 6+7+8+9+11 12.544 ± 4.128 -0.512 3.584 ± 0.923 0.512 bn120415891 6+7+9+10+11 0.960 ± 0.264 -0.256 0.320 ± 0.181 -0.192 bn120415958 10+11 12.544 ± 1.717 -4.352 4.096 ± 0.724 -2.816 bn120420249 1+2+5 25.600 ± 4.419 -0.768 6.912 ± 0.923 1.280 bn120420858 4+8 254.913 ± 4.222 0.003 124.866 ± 3.238 21.504 bn120426090 2+10 2.880 ± 0.181 0.224 1.152 ± 0.091 0.672 bn120426585 6+7+8+11 30.973 ± 3.620 0.003 13.824 ± 0.810 2.816 bn120427054 9+10+11 5.632 ± 0.572 0.256 2.048 ± 0.572 1.280 bn120427153 0+1+3+6+7 22.784 ± 1.999 -2.304 11.520 ± 1.086 -0.512 bn120429003 9+10+11 1.664 ± 0.968 -0.192 0.640 ± 0.326 0.000 bn120429484 0+1+3+4+5 15.360 ± 1.619 -1.024 10.240 ± 1.145 0.000 bn120430980 0+1+9 14.592 ± 2.172 -2.304 7.168 ± 1.717 -1.280 bn120504468 1+3+4+5 41.985 ± 2.673 -0.512 20.480 ± 0.724 5.888 bn120504945 6+7+11 5.760 ± 0.779 -2.304 2.048 ± 0.405 -0.640 bn120506128 3+6+7 2.304 ± 1.379 -0.768 1.280 ± 0.724 -0.512 bn120509619 6+9+10+11 0.704 ± 1.404 -0.192 0.320 ± 0.143 -0.128 bn120510900 10+11 62.465 ± 3.908 1.792 27.392 ± 1.493 15.872 bn120511638 3+8+9 45.249 ± 2.940 -0.128 24.576 ± 4.580 2.112 bn120512112 0+1+2+9+10 18.176 ± 1.350 0.384 7.360 ± 0.345 4.096 bn120513531 6+7+9 23.808 ± 0.923 -0.512 9.984 ± 8.764 8.448 bn120519721 4+7+8 0.960 ± 0.202 -0.128 0.448 ± 0.091 0.192 bn120520949 0+1+3+5 5.760 ± 1.356 -4.736 3.456 ± 0.345 -3.264 bn120521380 9+10+11 91.134 ± 4.222 0.004 19.456 ± 2.896 4.096 bn120522361 4+5 28.160 ± 8.039 -11.520 8.448 ± 1.056 3.072 bn120524134 3+4 0.704 ± 0.466 -0.128 0.256 ± 0.143 -0.128 bn120526303 4 43.649 ± 1.002 3.072 24.448 ± 0.272 13.120 bn120528442 9+10+11 16.384 ± 5.177 -0.768 5.376 ± 0.362 1.024 bn120530121 3+6+7 77.054 ± 1.810 0.003 51.457 ± 0.572 3.840

– 122 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn120531393 9+10+11 25.344 ± 7.186 -2.816 7.424 ± 0.923 -1.024 bn120603439 4+7+8 0.384 ± 0.345 -0.064 0.256 ± 0.091 -0.064 bn120604220 4+7+8 10.496 ± 5.615 -2.816 4.352 ± 2.111 -0.512 bn120604343 3+4+5 12.032 ± 3.278 -2.560 5.632 ± 1.280 0.000 bn120605453 9+10+11 18.112 ± 1.086 -0.640 3.389 ± 1.557 0.003 bn120608489 3+6+7 0.960 ± 1.611 -0.192 0.448 ± 0.326 -0.064 bn120608777 6+7+8 24.832 ± 3.840 -14.336 9.216 ± 0.810 -4.608 bn120609580 0+1+3 1.792 ± 0.810 -0.768 1.024 ± 0.362 -0.512 bn120611108 6+7+9 49.921 ± 1.639 -9.216 27.392 ± 1.846 1.280 bn120612680 9+10 63.232 ± 7.886 -10.496 32.256 ± 1.950 1.024 bn120612687 3+4+8 0.256 ± 0.453 -0.192 0.192 ± 0.143 -0.192 bn120616630^g 3+6+7 0.048 ± 0.484 -0.048 0.032 ± 0.036 -0.048 bn120618128 0+1+2+9 17.600 ± 1.820 -0.128 5.888 ± 0.572 1.600 bn120618919 10 47.616 ± 12.299 -20.480 14.848 ± 0.724 -3.584 bn120619884 6+7+9 0.960 ± 0.960 -0.256 0.384 ± 0.181 -0.128 bn120624309^b 1+2+9+10 0.640 ± 0.160 -0.064 0.160 ± 0.072 0.032 bn120624933 0+1+2+9+10 271.364 ± 4.580 -257.028 112.642 ± 4.580 -185.347 bn120625119 2+4+5 7.424 ± 0.571 -0.256 2.560 ± 0.362 2.048 bn120629565 3+6+7+8 0.704 ± 1.026 -0.384 0.320 ± 0.405 -0.256 bn120701654 8+10+11 1.024 ± 1.451 -0.960 0.128 ± 1.313 -0.192 bn120702891^p 6+7+9 35.073 ± 4.924 -1.024 15.360 ± 2.111 1.024 bn120703417 3+4+5 64.513 ± 3.083 -0.512 36.609 ± 2.064 3.840 bn120703498 4+8 77.568 ± 2.187 -2.048 34.304 ± 11.531 0.768 bn120703726 6+7+9+10+11 8.960 ± 1.379 0.768 1.536 ± 0.362 4.608 bn120707800 8+11 40.960 ± 4.238 1.520 16.640 ± 0.724 14.064 bn120709883 6+7+9 27.328 ± 0.958 -0.128 11.776 ± 0.362 10.816 bn120710100 0+3+4+6+7 131.840 ± 1.056 0.000 94.720 ± 5.382 26.112 bn120711115 2+10 44.033 ± 0.724 62.465 25.088 ± 0.724 71.681 bn120711446 0+1+3 87.552 ± 3.874 -1.280 45.312 ± 1.379 5.376 bn120712571 0+3+4+6+7 22.528 ± 5.431 -1.792 7.424 ± 0.572 2.048 bn120713226 3+4+5 13.824 ± 3.435 -3.072 5.888 ± 3.482 -1.280 bn120715066 0+2+9+10 29.696 ± 3.083 -4.864 14.080 ± 1.145 2.048 bn120716577 10+11 24.960 ± 3.958 -5.888 7.680 ± 0.820 0.512 bn120716712 9+10+11 237.056 ± 4.104 0.256 25.600 ± 0.362 180.736 bn120719146 1+2+9+10 75.009 ± 3.114 0.768 32.513 ± 1.086 7.168 bn120727354 0+1+2+9 0.896 ± 1.280 -0.896 0.512 ± 0.462 -0.640 bn120727681 1+2+9+10 10.496 ± 1.639 -0.224 4.125 ± 1.448 0.003

– 123 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn120728434 2+5 100.481 ± 6.623 11.008 50.753 ± 1.132 24.640 bn120728934 4+5 32.768 ± 2.429 -1.536 13.568 ± 0.923 2.048 bn120729456 1+2+9+10 25.472 ± 2.612 -1.024 8.320 ± 0.345 1.344 bn120801920 4 479.239 ± 23.752 -7.168 435.206 ± 1.448 6.144 bn120805706 2+9+10 1.856 ± 1.296 -0.960 0.768 ± 0.410 -0.704 bn120806007 6+7+8+9 26.624 ± 1.557 -0.256 7.680 ± 0.810 2.560 bn120811014 4+7+8 0.448 ± 0.091 -0.128 0.320 ± 0.091 -0.064 bn120811649 4+8 14.336 ± 6.557 -7.168 6.144 ± 2.721 -3.072 bn120814201 2+10 0.896 ± 1.032 -0.384 0.512 ± 0.231 -0.128 bn120814803 0+3+4+6+7 0.192 ± 0.272 -0.192 0.128 ± 0.181 -0.128 bn120817057 7+8+11 36.864 ± 4.672 -6.400 11.520 ± 1.448 -1.280 bn120817168 6+7+8+11 0.160 ± 0.113 -0.032 0.032 ± 0.023 -0.016 bn120819048 0+1+3 66.304 ± 1.379 -5.632 59.392 ± 0.572 -0.768 bn120820585 0+1+3+5 107.522 ± 9.159 -17.408 33.025 ± 5.790 -0.256 bn120822628 0+6+7+9 1.536 ± 0.842 -1.280 0.768 ± 0.707 -0.768 bn120824594 3+4+5+6 111.618 ± 7.241 -8.192 29.697 ± 3.692 5.120 bn120827216 2+10 5.056 ± 2.127 -1.664 1.984 ± 0.269 -0.128 bn120830212 10 16.064 ± 3.649 0.448 4.032 ± 0.640 1.856 bn120830297 0+1+3 0.896 ± 0.231 0.000 0.576 ± 0.181 0.128 bn120830702 0+1+2+3+5 49.665 ± 4.382 -15.616 22.784 ± 0.572 5.632 bn120831901 3+4+5 0.384 ± 0.547 -0.256 0.128 ± 0.143 -0.128 bn120905657 6+7+9+10+11 195.587 ± 16.795 -7.168 83.969 ± 7.384 10.240 bn120907017 4 5.760 ± 1.778 -1.920 1.152 ± 0.462 -0.896 bn120908873 2+10 46.849 ± 2.611 0.576 13.824 ± 0.724 10.048 bn120908938 3+4+8 66.945 ± 2.988 -4.608 32.193 ± 8.262 3.712 bn120909070 6+7+8 112.066 ± 10.419 -0.768 68.865 ± 3.661 14.976 bn120911298 6+7+9 22.016 ± 1.833 -4.480 7.936 ± 1.305 -0.512 bn120913846 1+2+5 33.792 ± 1.379 -1.536 22.272 ± 0.724 1.024 bn120913997 0+1+3+4+5 130.050 ± 3.566 -32.001 47.105 ± 1.056 2.304 bn120914144 3+4+7 10.240 ± 4.048 -1.280 2.304 ± 1.056 -0.512 bn120915000 0+1+3 0.576 ± 1.318 -0.320 0.320 ± 0.091 -0.128 bn120915474 3+4+7+8 5.888 ± 0.923 -2.304 3.328 ± 1.145 -0.768 bn120916085 3+4+6+7+8 1.280 ± 1.493 -0.256 0.896 ± 0.528 -0.256 bn120916173 6+9+10 52.993 ± 0.810 -52.737 20.480 ± 0.362 -49.921 bn120919052 0+1+3 118.018 ± 0.362 2.048 12.288 ± 0.362 35.840 bn120919309 0+1+2+3+5 21.248 ± 1.810 0.512 2.816 ± 0.572 2.304 bn120919816 6+7+8+9 20.480 ± 1.305 -3.072 6.656 ± 0.810 -1.280

– 124 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn120920003 6+7+9+11 28.160 ± 4.382 -1.792 12.288 ± 1.999 2.304 bn120921877 3+4+5 5.632 ± 1.145 -0.256 1.280 ± 0.572 0.000 bn120922939 1+2+5 182.275 ± 19.777 -113.666 95.233 ± 4.580 -92.162 bn120926335 0+1+2+9+10 4.288 ± 1.833 -0.640 1.536 ± 0.362 0.320 bn120926426 7+8 60.161 ± 3.482 -2.304 10.752 ± 1.305 0.768 bn120926753 7+8+11 3.072 ± 2.064 -1.536 1.280 ± 1.305 -1.280 bn121004211 3+4 1.536 ± 0.572 -0.512 0.768 ± 0.362 -0.256 bn121005030 5 96.768 ± 3.556 -31.232 26.880 ± 13.373 -12.800 bn121005340 0+1+2+5 141.568 ± 3.665 0.000 98.048 ± 2.290 17.152 bn121008424 0+1+9 3.456 ± 0.345 -0.320 2.304 ± 0.181 -0.128 bn121011469 0+1+2+3+5 65.793 ± 4.382 1.024 18.176 ± 1.305 3.840 bn121012724 6+7+8+9+11 0.448 ± 0.091 -0.128 0.256 ± 0.143 -0.064 bn121014638 6+7+8+9+11 0.576 ± 0.979 -0.640 0.192 ± 0.181 -0.448 bn121019233 6+7+8 14.336 ± 7.907 -2.560 6.912 ± 4.238 2.048 bn121023322 9+10 0.512 ± 0.181 -0.128 0.320 ± 0.091 -0.064 bn121027038 2+10 166.915 ± 3.692 -65.537 93.442 ± 2.415 -0.256 bn121028280 7+8+11 11.008 ± 2.360 -1.792 3.328 ± 0.724 -0.256 bn121029350 0+1+3+4+5 15.808 ± 0.572 -0.896 2.816 ± 0.572 10.816 bn121031949 3+4+5 242.436 ± 4.404 -27.392 193.795 ± 1.145 4.096 bn121102064 3+4+5 2.048 ± 1.379 -1.536 1.280 ± 0.572 -0.768 bn121104627 6+9+10+11 59.137 ± 7.241 -1.024 20.224 ± 3.665 2.304 bn121109338 8+11 22.144 ± 2.919 -6.912 5.824 ± 0.272 0.512 bn121112806 6+7+9+10+11 1.280 ± 1.358 -0.128 0.384 ± 0.590 0.128 bn121113544 9+10 95.490 ± 2.611 1.536 49.665 ± 0.572 12.032 bn121116459 4+5 0.832 ± 0.590 -0.704 0.448 ± 0.181 -0.448 bn121117018 0+1+2+3+5 331.782 ± 4.048 -270.341 48.385 ± 2.986 -30.977 bn121118576 1+2+9+10 33.277 ± 0.808 0.003 17.920 ± 0.724 3.840 bn121119579 6+7+8 2.304 ± 0.429 -0.256 1.024 ± 0.202 -0.064 bn121122564 6+7+9+10+11 8.704 ± 0.724 -1.280 3.072 ± 0.572 -0.768 bn121122870 9+10+11 125.439 ± 0.724 0.003 108.290 ± 0.724 11.520 bn121122885 10 7.936 ± 0.572 0.512 3.584 ± 0.362 2.048 bn121123421 3+4+5 102.338 ± 31.849 3.840 34.625 ± 8.155 18.560 bn121123442 9+10+11 42.497 ± 1.999 2.304 17.408 ± 0.572 11.520 bn121124606 10+11 0.256 ± 0.842 -0.128 0.128 ± 0.143 -0.128 bn121125356 0+3+4+6 49.857 ± 2.099 -6.144 25.088 ± 0.724 9.024 bn121125469 0+1+3 12.864 ± 4.844 -2.304 4.416 ± 1.088 -1.024 bn121127914 4+8 0.640 ± 0.405 -0.064 0.128 ± 0.091 0.000

– 125 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn121128212 3+4 17.344 ± 0.923 -0.768 6.016 ± 0.181 3.008 bn121202181 0+1+2+5 17.152 ± 1.999 -4.608 10.240 ± 1.145 -1.792 bn121205507 0+1+3 2.816 ± 0.231 -0.384 2.432 ± 0.272 -0.192 bn121210081 3+4 12.800 ± 3.238 -1.536 7.164 ± 1.448 0.004 bn121211574 3+4+5 5.632 ± 1.717 -3.072 2.048 ± 1.145 -1.536 bn121211695 6+7+9+10+11 8.960 ± 1.864 -0.512 3.328 ± 0.362 0.256 bn121216419 3+4 9.216 ± 2.560 -2.048 5.120 ± 0.810 -0.256 bn121217313 9+10 828.672 ± 11.363 -807.424 736.512 ± 1.280 -736.256 bn121220311 6+7+9 5.120 ± 0.810 -1.280 3.584 ± 0.724 -0.512 bn121221916 0+1+3+4+5 38.913 ± 2.290 -3.072 14.336 ± 2.896 1.024 bn121223300 6+7+8+9+11 11.005 ± 0.724 0.003 4.096 ± 0.362 2.048 bn121225417 1+3+5 58.497 ± 0.820 9.472 35.585 ± 0.181 19.328 bn121229533 3+4+5 23.037 ± 1.810 0.003 6.656 ± 0.724 2.048 bn121231445 1+2+5 32.768 ± 5.152 -5.632 13.312 ± 2.318 0.000 bn130104721 0+1+3 26.368 ± 3.593 -1.792 9.472 ± 0.572 2.560 bn130106829 0+1+3 11.264 ± 1.379 -2.560 7.420 ± 0.572 0.004 bn130106995 2+5 70.401 ± 0.572 -1.024 49.921 ± 0.923 7.168 bn130109206 0+1+3+5 8.960 ± 1.208 -3.584 2.816 ± 0.462 0.576 bn130112286 0+1+3+5 35.328 ± 1.846 -29.696 14.848 ± 2.111 -12.288 bn130112353 6+7+9 2.048 ± 1.557 -0.768 0.768 ± 0.362 -0.256 bn130114019 0+1+3+4+5 8.704 ± 1.846 -2.048 4.608 ± 1.619 -1.024 bn130115716 6+7+8+11 13.568 ± 1.846 -3.840 5.888 ± 0.572 1.280 bn130116415 4+5 66.816 ± 6.085 -4.096 47.360 ± 1.639 -1.792 bn130117087 3+4+6 78.848 ± 2.636 1.792 30.464 ± 1.280 22.528 bn130118482 3+4+7 21.568 ± 14.999 -5.632 6.400 ± 1.231 -0.576 bn130121835 4+8 178.691 ± 1.145 1.792 25.856 ± 2.318 5.632 bn130123843 0+1+3+5 22.02 ± 1.45 -3.328 11.78 ± 0.572 -0.256 bn130127299 0+1+3 19.456 ± 2.721 -3.840 12.288 ± 3.665 -1.536 bn130127743 0+1+3+4+5 0.144 ± 0.804 -0.112 0.016 ± 0.036 -0.016 bn130131511 7+8 147.459 ± 1.145 3.584 55.553 ± 0.572 24.576 bn130204484 0+6+9+10 0.192 ± 0.091 -0.128 0.128 ± 0.091 -0.128 bn130206482 0+1+2+3+5 11.264 ± 1.950 -4.608 2.816 ± 0.724 1.280 bn130206817 3+6 91.586 ± 12.332 -2.560 46.849 ± 3.967 2.560 bn130208684 6+7+9+10+11 41.472 ± 2.360 -1.024 30.208 ± 0.923 2.304 bn130209961 6+7+9 9.790 ± 0.408 0.003 5.120 ± 0.572 3.136 bn130213905 9+10+11 15.360 ± 6.557 -5.632 6.144 ± 2.064 -1.792 bn130214137 0+1+3+5 96.768 ± 5.443 -3.328 48.384 ± 3.908 1.792

– 126 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn130214800 3+4+6+7+8 13.760 ± 1.639 -3.584 4.288 ± 0.320 1.152 bn130215063 1+2+10 143.746 ± 13.029 -5.632 38.913 ± 1.741 7.680 bn130215649 4+5 58.113 ± 1.557 6.912 26.368 ± 0.810 17.152 bn130216790 2+10 12.992 ± 1.280 -5.248 3.072 ± 0.572 0.576 bn130216927 1+2+9+10 6.592 ± 0.345 -0.192 3.136 ± 0.466 2.176 bn130217688 7+8+11 14.848 ± 2.202 -11.264 4.608 ± 2.290 -4.096 bn130218261 2+10 37.121 ± 3.665 -6.144 19.200 ± 0.923 6.144 bn130219197 7+8+9+10+11 168.003 ± 2.172 5.376 68.353 ± 1.145 44.097 bn130219626 9+10+11 1.536 ± 1.405 -1.088 0.064 ± 0.091 -0.064 bn130219775 3+4+5 96.130 ± 0.405 0.640 9.536 ± 0.272 75.777 bn130220964 0+1+2+3+5 6.400 ± 0.810 0.256 2.816 ± 0.362 1.280 bn130224370 3+4+6+7+8 70.913 ± 4.291 -35.841 13.056 ± 3.416 -4.096 bn130228111 0+1+3 111.106 ± 2.986 -11.008 62.721 ± 1.379 22.272 bn130228212 10 15.421 ± 0.407 0.003 8.192 ± 0.362 5.696 bn130304410 10+11 67.841 ± 2.862 0.832 20.992 ± 0.810 4.672 bn130304658 2+10 23.296 ± 4.382 -15.360 9.984 ± 0.923 -3.584 bn130305486 6+7+9+10 25.600 ± 1.557 1.280 4.864 ± 0.572 4.352 bn130305526 0+1+3 118.528 ± 15.691 1.280 92.672 ± 3.566 6.912 bn130306991 2+4+5 120.578 ± 5.515 -17.664 36.609 ± 1.448 16.128 bn130307126 6+7+8+9+11 0.384 ± 0.091 -0.064 0.256 ± 0.091 0.000 bn130307238 4+5 63.488 ± 1.846 -12.288 26.880 ± 0.923 -2.560 bn130310840 9+10+11 16.000 ± 2.561 4.096 0.704 ± 0.091 4.160 bn130314147 6+7+8 142.851 ± 2.360 1.536 50.945 ± 1.305 9.216 bn130318456 6+7 121.088 ± 1.448 -2.816 112.640 ± 0.923 1.280 bn130320560 0+1+6+9+10 352.768 ± 2.111 -138.496 301.056 ± 1.056 -136.704 bn130324042 0+1+2+9+10 56.320 ± 2.862 -6.144 19.712 ± 1.379 0.512 bn130325005 6+7+9 0.640 ± 0.453 -0.064 0.256 ± 0.231 -0.064 bn130325203 6+7+8+9+11 6.912 ± 0.724 0.768 2.304 ± 0.572 1.792 bn130327350 0+1+2 31.233 ± 0.724 2.048 18.688 ± 0.362 7.168 bn130331566 8+11 13.824 ± 1.379 -0.512 3.840 ± 0.362 3.328 bn130403866 7+8+11 22.784 ± 5.838 -7.936 9.728 ± 2.415 -1.792 bn130404428 1+3+4+5 3.328 ± 1.493 -1.536 2.048 ± 1.280 -0.768 bn130404840 6+7 34.561 ± 2.573 0.320 22.016 ± 0.572 1.344 bn130404877 0+1+3 0.960 ± 1.729 -0.128 0.256 ± 0.607 -0.064 bn130406288 0+6+9+10 7.936 ± 1.305 -0.512 1.536 ± 0.572 0.512 bn130406334 2+10 88.832 ± 3.444 -5.120 25.088 ± 25.876 -1.280 bn130406354 0+1+3 2.560 ± 1.619 -1.280 0.768 ± 0.923 -0.512

– 127 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn130407800 0+1+3+5 32.000 ± 9.137 -5.632 13.824 ± 2.415 -1.024 bn130408653 3+4+5 9.216 ± 3.665 -4.864 2.560 ± 0.724 -0.256 bn130409960 1+2+5 26.112 ± 1.056 0.256 7.680 ± 1.056 9.472 bn130416690 0+1+3 3.072 ± 2.429 -2.816 1.280 ± 1.056 -1.792 bn130416770 3+4+5 0.192 ± 0.425 -0.048 0.048 ± 0.036 0.000 bn130418844 7+8+11 169.472 ± 2.560 -45.056 99.328 ± 0.923 -3.072 bn130420313 2+10 104.962 ± 8.809 -59.649 23.040 ± 3.278 -9.728 bn130420343 3+4+6+7+8 38.913 ± 2.111 -15.872 13.312 ± 1.086 -4.096 bn130420422 10+11 27.329 ± 5.101 -2.432 5.376 ± 1.305 0.576 bn130420539 3+6+7+8 13.824 ± 5.278 -7.168 4.864 ± 0.923 -2.048 bn130425327 10 62.209 ± 1.145 1.856 18.432 ± 0.724 36.929 bn130427324 6+9+10 138.242 ± 3.238 4.096 4.096 ± 1.448 6.144 bn130502327 6+7+8 24.320 ± 0.362 7.168 10.240 ± 0.362 13.568 bn130502743 9+10 3.328 ± 2.064 -0.512 2.304 ± 0.572 -0.256 bn130503214 6+7+9 0.880 ± 0.910 -0.864 0.016 ± 0.865 -0.016 bn130504314 3+4 0.384 ± 0.181 0.000 0.192 ± 0.091 0.064 bn130504978 2+9+10 73.217 ± 2.111 8.704 46.849 ± 0.362 17.664 bn130505955 4+8 50.241 ± 8.009 0.384 20.480 ± 1.346 3.456 bn130507545 4+6+7+8 60.160 ± 5.938 0.000 22.016 ± 0.724 4.096 bn130509078 6+7+9 24.320 ± 3.593 0.512 7.424 ± 0.572 2.048 bn130509839 0+1+3+5 31.488 ± 2.673 -4.864 11.264 ± 1.379 -0.512 bn130510877 3+4 29.440 ± 4.261 -4.096 9.728 ± 1.379 0.000 bn130514560 2+10 17.408 ± 3.435 -0.512 4.608 ± 0.572 0.000 bn130515056 4+8 0.256 ± 0.091 -0.064 0.064 ± 0.091 0.000 bn130515430 4+6+7+8 20.480 ± 5.120 -3.584 10.496 ± 1.639 -1.024 bn130515755 2+10 2.560 ± 0.572 -0.512 1.536 ± 0.572 -0.256 bn130517781 0+1+3 33.280 ± 1.280 0.512 17.920 ± 0.572 6.400 bn130518551 6+7+8+9+11 4.096 ± 2.573 0.000 1.280 ± 0.572 0.256 bn130518580 3+4+6+7 48.577 ± 0.916 9.920 6.848 ± 0.181 23.872 bn130522510 3+4+5 27.904 ± 3.367 -0.512 15.872 ± 0.724 1.792 bn130523095 2+5 17.920 ± 1.448 2.560 9.472 ± 0.362 9.216 bn130523198 0+1+3+6+7+9 5.376 ± 0.923 -1.280 2.560 ± 0.572 0.256 bn130527627 2+9+10 27.776 ± 1.438 -0.896 9.408 ± 0.345 5.888 bn130528503 0+1+2 66.304 ± 6.700 -39.680 20.736 ± 0.810 -16.896 bn130528695 0+2+5 55.553 ± 1.864 0.576 25.856 ± 1.557 3.904 bn130530719 0+1+6+9 58.621 ± 1.863 0.003 28.160 ± 2.064 3.840 bn130604033 9+10+11 26.880 ± 0.923 -0.256 8.192 ± 0.362 9.216

– 128 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn130606316 3+4+6+7+8 24.128 ± 0.410 -0.256 9.280 ± 0.373 3.264 bn130606497 7+8+11 52.225 ± 0.724 5.376 35.329 ± 0.572 11.776 bn130609129 6+7+9 5.376 ± 1.498 -2.624 2.560 ± 0.975 -1.600 bn130609902 4+5 191.491 ± 2.862 4.864 15.104 ± 0.724 9.728 bn130610133 7+8 21.760 ± 1.639 -2.560 7.680 ± 0.724 2.816 bn130611538 6+7 66.816 ± 6.700 0.256 22.784 ± 1.379 5.376 bn130612141 6+7+9+11 7.424 ± 6.192 -2.560 2.048 ± 1.379 -1.280 bn130612456 6+7+8 10.240 ± 0.653 0.352 1.664 ± 0.181 1.440 bn130614997 0+1+3 9.280 ± 1.972 -0.064 2.944 ± 0.286 0.768 bn130615398 2+10 21.760 ± 6.763 -4.864 5.888 ± 1.086 -0.768 bn130617564 2 0.768 ± 0.630 -0.448 0.384 ± 0.181 -0.320 bn130620498 0+1+3+5 14.592 ± 4.404 -11.264 4.608 ± 1.305 -4.096 bn130622615 6+7+8+11 0.960 ± 0.429 -0.768 0.384 ± 0.231 -0.384 bn130623130 0+3+4+6+7 29.440 ± 0.724 -0.512 28.416 ± 0.724 0.000 bn130623396 0+3+4+7 44.544 ± 3.665 -2.816 16.128 ± 3.238 1.024 bn130623488 0+3+4 22.272 ± 0.923 -1.792 13.312 ± 1.145 2.816 bn130623699 10+11 7.680 ± 2.560 -5.632 2.560 ± 1.145 -3.840 bn130623790 4+5 42.241 ± 1.863 0.256 25.088 ± 0.724 5.632 bn130624093 6+7+9+11 13.824 ± 5.152 -2.816 6.912 ± 1.086 -0.256 bn130626452 7+8+9+10+11 1.728 ± 0.771 -0.064 0.320 ± 0.580 -0.064 bn130626596 3+4 28.160 ± 0.572 -18.176 10.752 ± 0.572 -6.912 bn130627372 0+1+3 35.840 ± 1.717 -17.920 8.960 ± 0.724 -2.048 bn130628531 0+1+2+9+10 21.504 ± 1.619 -0.256 3.072 ± 0.572 2.304 bn130628860 6+7+9+10+11 0.512 ± 0.143 -0.064 0.384 ± 0.091 0.000 bn130630272 4+5 17.152 ± 0.572 0.512 7.424 ± 0.362 3.840 bn130701060 2+10 20.224 ± 1.729 -0.512 3.200 ± 0.272 2.624 bn130701761 9+10+11 1.600 ± 0.143 -0.064 0.704 ± 0.143 0.320 bn130702004 4 58.881 ± 6.192 0.768 18.688 ± 1.810 3.840 bn130702951 6+7+8+9+11 16.384 ± 4.128 -4.096 7.168 ± 2.360 -1.024 bn130704560 3+4+5 6.400 ± 0.572 0.512 2.304 ± 0.362 1.536 bn130705398 3+4+5 0.128 ± 0.528 -0.064 0.064 ± 0.091 -0.064 bn130706900 9+10+11 0.128 ± 1.118 -0.064 0.064 ± 0.091 -0.064 bn130707505 9+10 76.545 ± 3.083 -2.048 38.401 ± 1.305 12.032 bn130708488 1+2+9+10 14.077 ± 3.114 0.003 4.608 ± 0.724 1.792 bn130715906 10+11 47.873 ± 1.145 5.888 19.456 ± 0.810 22.528 bn130716352 0+3+4 91.136 ± 10.801 -3.328 38.912 ± 3.114 4.352 bn130716442 0+1+2 0.768 ± 0.389 -0.448 0.256 ± 0.143 0.000

– 129 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn130717734 6+7+8+11 55.296 ± 3.125 -3.328 40.960 ± 1.950 3.328 bn130720116 6+7+9 48.640 ± 3.874 -0.256 22.016 ± 6.676 1.792 bn130720582 9+10+11 199.172 ± 5.221 -13.568 104.450 ± 0.724 38.401 bn130722021 6+7+9 81.408 ± 5.184 -0.256 45.568 ± 2.721 4.608 bn130722990 6+7+9 2.304 ± 1.379 -0.768 0.512 ± 0.362 -0.256 bn130723092 3+4+6+7+8 8.192 ± 2.064 -0.768 1.536 ± 0.572 -0.256 bn130725527 6+7+8+9 6.656 ± 0.860 -0.384 1.472 ± 0.181 1.600 bn130727698 8+11 12.992 ± 0.871 -1.024 5.952 ± 0.231 1.472 bn130730243 0+1+3 27.904 ± 1.999 -8.704 7.680 ± 1.145 -3.584 bn130802730 1+3+4+5 0.064 ± 0.258 -0.064 0.032 ± 0.045 -0.032 bn130803419 2+9+10 7.616 ± 1.145 -3.328 1.792 ± 0.231 0.192 bn130804023 6+7+9 0.960 ± 0.091 -0.064 0.768 ± 0.091 0.064 bn130808253 4+5 0.256 ± 0.898 -0.128 0.064 ± 0.091 -0.064 bn130811186 0+1+3+5 44.801 ± 10.780 -2.304 11.776 ± 0.923 4.864 bn130813791 0+1+2+5 11.264 ± 1.145 -9.472 3.328 ± 0.362 -3.072 bn130815420 3+4+5 236.292 ± 0.810 -5.888 53.505 ± 0.923 83.713 bn130815660 3+4+5 37.889 ± 1.056 1.280 2.560 ± 0.572 31.744 bn130816074 0+3+6+7 36.864 ± 6.229 -1.024 26.624 ± 2.290 2.048 bn130818941 3+4+5 25.344 ± 3.183 -16.896 4.352 ± 0.286 2.880 bn130819394 3+4+5 82.689 ± 4.536 -1.536 36.609 ± 1.639 9.984 bn130821674 6+7+9+10+11 87.041 ± 1.145 3.584 10.752 ± 0.572 25.088 bn130828306 0+3+4 136.450 ± 0.923 13.312 67.329 ± 0.572 30.976 bn130828808 0+1+2+5 3.904 ± 0.842 0.192 1.344 ± 0.143 0.704 bn130829672 4+8 6.656 ± 1.619 -0.256 2.048 ± 0.362 1.024 bn130830864 0+1+3 83.968 ± 7.455 -2.048 40.960 ± 5.514 6.144 bn130830921 8+11 36.352 ± 1.717 -3.072 11.264 ± 1.619 -0.256 bn130831058 0+1+9+10 24.832 ± 0.810 -6.912 13.824 ± 0.923 -2.560 bn130903033 0+1+9 68.608 ± 7.241 -3.072 36.864 ± 3.238 4.096 bn130905377 1+2+9+10 21.248 ± 1.305 -0.256 6.144 ± 1.086 1.792 bn130906222 1+2+5 11.264 ± 7.209 -5.120 3.584 ± 0.724 -3.072 bn130906435 6+7+8+11 8.192 ± 2.769 -3.584 1.280 ± 0.362 -0.256 bn130907760 3+4+6+7+8 3.136 ± 2.691 -0.320 1.280 ± 2.244 -0.128 bn130908677 3+4+5 66.048 ± 30.551 -1.792 24.064 ± 4.048 5.120 bn130909817 0+1+2+5 33.792 ± 7.322 -14.848 9.984 ± 1.086 -2.560 bn130912358 7+8+11 0.512 ± 0.143 -0.064 0.256 ± 0.143 -0.064 bn130919173 6+7+8 0.960 ± 0.143 -0.064 0.128 ± 0.091 0.640 bn130919352 6+7+8+9+11 80.897 ± 3.665 0.768 39.937 ± 1.448 10.496

– 130 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn130919985 3+4+5 17.408 ± 4.382 -4.096 7.936 ± 1.086 -0.512 bn130924255 8+11 37.120 ± 7.534 -21.760 9.472 ± 0.923 -7.936 bn130924910 0+1+6+9+10 1.792 ± 3.167 -0.256 0.768 ± 0.572 -0.256 bn130925164^h 0+1 6.400 ± 2.429 -3.840 3.328 ± 1.379 -2.816 bn130925173^h 6+7+9 215.555 ± 1.810 11.008 94.977 ± 1.846 42.497 bn130925546 8+11 265.477 ± 3.338 -217.604 45.569 ± 12.841 -17.664 bn130928537 10+11 132.994 ± 1.236 0.512 59.201 ± 1.374 12.416 bn130929375 0+1+3+4+5 2.304 ± 0.487 -2.240 1.152 ± 0.231 -1.600 bn131002288 4 55.040 ± 1.379 -46.080 30.976 ± 39.710 -29.696 bn131004904 9+10 1.152 ± 0.590 -0.192 0.448 ± 0.143 -0.064 bn131006367 10+11 0.128 ± 0.389 -0.128 0.064 ± 0.143 -0.128 bn131006840 2+5 41.984 ± 5.120 -4.096 17.408 ± 2.896 -1.024 bn131008858 10 36.349 ± 3.367 0.003 10.496 ± 1.056 2.560 bn131011741 7+9+10+11 77.057 ± 2.996 -4.624 17.920 ± 0.810 4.080 bn131014215 9+10+11 3.200 ± 0.091 0.960 1.536 ± 0.091 1.728 bn131014513 8+11 30.208 ± 4.636 -21.248 4.096 ± 0.572 -0.256 bn131018673 6+7+9 39.936 ± 12.331 -1.024 13.312 ± 2.290 3.072 bn131020113 1+2+5 2.240 ± 1.145 -0.832 0.768 ± 0.345 -0.512 bn131021352 8+10+11 17.664 ± 3.258 -0.768 10.240 ± 0.572 0.000 bn131024900 3+4+7+8 45.312 ± 5.538 -2.304 26.112 ± 2.769 2.304 bn131028076 2+5 17.152 ± 0.572 2.816 5.888 ± 0.362 6.912 bn131028096 7+8+11 14.336 ± 3.238 -1.280 9.472 ± 1.280 0.000 bn131029973 0+1+3+4+5 104.449 ± 7.241 1.024 66.561 ± 2.896 10.240 bn131029990 6+7+9+10+11 50.944 ± 5.976 -7.936 19.200 ± 1.280 0.768 bn131030653 6+7+8+11 53.248 ± 3.665 -1.280 27.136 ± 0.810 1.792 bn131030791 0+1+2+3+5 27.392 ± 5.431 -2.560 8.448 ± 1.145 1.024 bn131031482 6+7+9+11 7.424 ± 0.604 -0.256 4.352 ± 0.231 1.024 bn131102622 6+7+9 62.976 ± 7.886 0.000 29.952 ± 3.238 4.864 bn131105087 6+7+8 112.642 ± 0.462 2.496 73.985 ± 0.320 33.280 bn131108024 7+8+11 14.592 ± 3.999 -3.584 5.376 ± 0.572 0.512 bn131108862 0+3+6+7 18.176 ± 0.572 0.320 8.192 ± 0.572 2.368 bn131110373 9+10+11 27.328 ± 1.294 -2.304 12.800 ± 0.746 3.776 bn131113483 1+2+5 60.545 ± 1.417 3.392 20.352 ± 0.320 16.832 bn131117766 0+1+3+4+5 93.954 ± 4.419 -1.792 32.513 ± 1.056 14.592 bn131118958 2+5 85.249 ± 4.382 5.632 44.289 ± 0.923 18.432 bn131119781 6+7+8+11 34.816 ± 0.810 -2.560 20.224 ± 4.615 0.256 bn131122490 3+4+5 23.040 ± 0.810 1.536 8.704 ± 0.362 10.240

– 131 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn131123543 9+10+11 3.136 ± 0.716 0.000 1.088 ± 0.590 0.384 bn131125689 10+11 3.008 ± 2.159 -0.576 0.320 ± 0.231 -0.192 bn131126163 2+5 0.128 ± 0.353 -0.016 0.048 ± 0.045 0.000 bn131127480 6+7+8+9+11 59.648 ± 8.964 0.768 24.320 ± 1.379 7.680 bn131127592 1+2+5 18.176 ± 0.724 1.792 11.520 ± 0.572 4.352 bn131127696 0+1+2+3+5 15.104 ± 5.049 -1.792 3.840 ± 0.923 -0.256 bn131128629 9+10 1.984 ± 0.543 -0.960 0.832 ± 0.272 -0.576 bn131202633 1+2+5 19.968 ± 7.748 -4.352 8.704 ± 2.187 -1.792 bn131202906 3+4+8 86.018 ± 2.111 1.280 30.465 ± 1.145 10.752 bn131204937 6+7+9 29.952 ± 1.056 -0.512 17.408 ± 0.572 4.096 bn131209547 6+7+9 13.568 ± 1.145 2.816 6.400 ± 0.362 6.144 bn131209963 2+10 4.096 ± 3.125 -0.512 1.280 ± 0.724 -0.256 bn131211510 0+1+3 44.800 ± 4.971 -12.544 11.008 ± 0.923 -4.608 bn131212814 6+7+9 7.424 ± 4.720 -3.584 3.072 ± 2.064 -1.536 bn131214705 0+1+2 80.065 ± 0.871 2.048 37.056 ± 1.350 31.296 bn131215298 10+11 23.040 ± 2.360 2.560 10.752 ± 0.572 4.352 bn131216081 6+7+9+10+11 19.262 ± 3.598 0.003 3.072 ± 0.572 1.088 bn131217108 10+11 0.768 ± 1.924 -0.064 0.384 ± 0.181 0.064 bn131217183 0+1+2 9.216 ± 1.145 -2.304 4.608 ± 0.572 0.768 bn131217506 0+1+2 9.216 ± 1.145 -2.304 4.608 ± 0.572 0.768 bn131229277 9+10+11 12.992 ± 0.231 2.144 6.592 ± 0.202 7.328 bn131230529 4+8 3.072 ± 1.056 -2.560 1.536 ± 0.724 -2.304 bn131230808 6+7+8+9+11 49.152 ± 4.352 -10.752 14.848 ± 1.086 -1.536 bn131231198 0+3+4 31.232 ± 0.572 13.312 9.728 ± 0.362 21.504 bn140102887 6+7+9+11 3.648 ± 0.091 0.448 1.920 ± 0.091 1.024 bn140104731 6+7+9+11 188.417 ± 1.448 9.216 141.313 ± 2.290 36.864 bn140105065 9+10+11 1.088 ± 0.466 -0.384 0.384 ± 0.091 0.000 bn140105748 6+9+10 0.576 ± 0.716 -0.192 0.384 ± 0.231 -0.064 bn140106345 2+5 33.024 ± 7.241 -0.512 12.032 ± 1.864 2.048 bn140108721 1+2+9+10 91.393 ± 2.360 1.536 79.105 ± 0.572 6.912 bn140109771 10+11 0.704 ± 0.773 -0.960 0.384 ± 0.528 -0.704 bn140109877 0+3+6+7 3.328 ± 2.560 -1.024 0.768 ± 1.810 -0.256 bn140110263 6+7+8+9 9.472 ± 1.619 -0.256 3.584 ± 0.724 1.024 bn140110411 0+1+3 0.768 ± 0.345 -0.768 0.320 ± 0.091 -0.512 bn140110814 8 81.152 ± 6.582 -17.408 47.104 ± 1.619 -0.768 bn140112060 0+1+2+5 12.032 ± 5.278 -3.328 6.656 ± 0.362 -0.768 bn140113183 7+8+9+11 68.864 ± 2.985 -5.888 33.792 ± 3.665 -0.512

– 132 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn140113624 1+2+5 4.608 ± 2.360 -0.768 2.048 ± 0.810 -0.256 bn140115863 3+4+8 14.909 ± 1.072 0.003 6.144 ± 0.572 3.904 bn140115899 9+10 10.496 ± 1.950 -1.792 3.840 ± 0.572 0.512 bn140118064 1+2+5 90.112 ± 2.202 -71.168 56.064 ± 2.429 -51.712 bn140122597 7+8 3.584 ± 1.864 -0.256 1.536 ± 0.724 0.256 bn140124527 0+1+3 121.538 ± 5.838 -12.672 62.977 ± 1.846 6.208 bn140126815 6+7+8 75.776 ± 2.290 -58.368 24.576 ± 2.896 -15.360 bn140129499 8+11 0.128 ± 0.707 -0.064 0.128 ± 0.091 -0.064 bn140204547 6+7+9 71.168 ± 8.798 -1.536 33.024 ± 1.864 4.096 bn140206275 0+1+2+3+5 146.690 ± 4.419 7.488 24.576 ± 0.810 13.888 bn140206304 10+11 27.264 ± 1.243 0.512 5.120 ± 0.272 3.456 bn140209313 9+10 1.408 ± 0.264 1.344 0.320 ± 0.091 1.536 bn140211091 6+7+9 3.456 ± 0.724 -0.896 1.024 ± 0.181 -0.384 bn140213807 0+1+2 18.624 ± 0.716 0.768 5.056 ± 0.091 2.304 bn140216331 9+10+11 2.432 ± 0.590 -1.728 1.216 ± 1.223 -0.832 bn140217043 6+7+9 27.136 ± 14.082 -0.256 13.824 ± 0.923 1.536 bn140218427 3+4+5 53.505 ± 5.684 -1.024 31.489 ± 1.950 4.864 bn140219319 0+1+3 6.080 ± 0.464 -0.128 3.072 ± 0.362 1.856 bn140219824 7+8+9+10+11 77.056 ± 2.996 -2.560 46.848 ± 1.639 5.888 bn140223495 6+7+8+11 17.408 ± 2.064 -0.768 4.352 ± 0.362 0.768 bn140224382 2+5 2.304 ± 2.111 -0.512 1.024 ± 1.056 0.000 bn140224788 3+4+6+7+8 17.152 ± 1.846 -1.792 6.144 ± 1.379 1.024 bn140227738 2+10 17.152 ± 9.073 -16.384 5.888 ± 4.971 -7.680 bn140302342 0+1+3 67.584 ± 5.655 0.256 25.600 ± 0.724 6.656 bn140304557 0+1+3+4+5 31.232 ± 8.719 -5.376 10.240 ± 0.572 0.000 bn140304849 3+4+5 232.708 ± 1.145 1.024 182.531 ± 1.717 21.760 bn140306146 0+1+3+4+5 51.713 ± 0.810 1.088 24.576 ± 0.572 6.208 bn140308710 1+2+5 12.032 ± 1.846 0.768 3.584 ± 0.572 2.048 bn140311453 1+2+5 14.912 ± 1.619 -1.024 7.040 ± 0.373 0.768 bn140311618 9+10 14.336 ± 5.684 -3.072 3.072 ± 0.724 0.256 bn140311885 4+8 72.193 ± 8.764 -4.352 27.649 ± 1.086 5.632 bn140319964 1+2+9+10 50.369 ± 1.448 -1.408 13.056 ± 0.362 5.440 bn140320092 0+3+6+7 2.304 ± 1.527 -1.216 1.024 ± 0.231 -0.832 bn140322424 3+4+7+8 10.496 ± 2.111 -2.048 4.096 ± 0.572 0.256 bn140323433 0+1+2+9 111.426 ± 3.027 5.056 64.705 ± 0.810 24.960 bn140327065 0+1+3 11.520 ± 7.286 -4.864 3.840 ± 0.923 0.000 bn140328560 0+1+3+5 4.160 ± 0.653 -1.088 2.240 ± 0.143 -0.640

– 133 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn140329272 0+1+3+5 0.064 ± 0.295 -0.032 0.032 ± 0.045 -0.032 bn140329295 8+11 21.504 ± 0.810 5.648 2.816 ± 0.362 21.520 bn140330180 0+1+3 34.049 ± 10.509 0.256 9.984 ± 1.305 1.792 bn140402007 0+1+3 0.320 ± 0.630 -0.128 0.128 ± 0.143 -0.064 bn140404030 6+7+9 84.992 ± 5.910 -72.704 70.656 ± 1.864 -67.840 bn140404171 0+1+2+3 26.624 ± 0.326 0.192 12.224 ± 0.202 5.056 bn140404900 0+1+3+4 22.784 ± 1.864 -1.024 8.448 ± 0.572 3.072 bn140405033 0+1+3 39.936 ± 3.874 -0.512 12.288 ± 1.379 1.536 bn140406120 1+2+5 109.312 ± 3.415 -32.000 59.136 ± 4.810 -4.096 bn140406144 0+1+2 37.120 ± 4.291 -4.096 24.064 ± 5.431 1.024 bn140408553 3+4+7+8 7.680 ± 3.367 -1.024 3.072 ± 1.864 0.000 bn140414693 0+1+3+4+5 25.600 ± 2.202 -11.776 7.424 ± 0.724 1.280 bn140416060 2 31.744 ± 1.280 -2.784 16.576 ± 0.143 6.816 bn140422194 9+10+11 361.472 ± 9.882 -4.352 311.296 ± 3.556 8.448 bn140423356 6+7+9+10+11 95.233 ± 11.585 -66.561 46.081 ± 5.793 -37.889 bn140426515 7+8+11 37.568 ± 3.535 -4.736 14.784 ± 0.429 -1.024 bn140427702 8 13.312 ± 7.131 -3.840 4.608 ± 5.684 -3.328 bn140428906 2+5 0.320 ± 0.286 -0.256 0.064 ± 0.091 -0.064 bn140429975 0+1+3 9.216 ± 1.639 -5.120 3.328 ± 0.724 -3.072 bn140430716 7+8 26.368 ± 5.615 -12.800 4.096 ± 0.724 0.768 bn140501139 7+8+11 0.256 ± 0.630 -0.128 0.064 ± 0.091 -0.064 bn140501497 2+5 22.144 ± 5.186 -0.128 7.552 ± 0.181 1.856 bn140502354 0+1+2+5 20.096 ± 0.916 -1.536 6.336 ± 0.590 0.512 bn140506880 2+5 64.128 ± 2.005 -3.968 6.016 ± 5.440 0.000 bn140508128 10 44.288 ± 0.231 2.816 21.184 ± 0.091 5.056 bn140508179 8 19.456 ± 2.290 -1.024 9.216 ± 2.896 3.072 bn140508629 0+3+4+6+7+8 50.433 ± 8.464 -0.256 24.320 ± 3.874 4.864 bn140511095 0+1+3+4+5 1.408 ± 0.889 -0.064 0.256 ± 0.181 -0.064 bn140511995 1+2+5 59.136 ± 1.379 -1.024 13.824 ± 1.145 20.224 bn140512814 0+1+2+3+5 147.970 ± 2.360 2.048 80.129 ± 6.931 51.969 bn140513724 6+7+9+10+11 17.152 ± 2.111 -0.512 5.120 ± 0.810 1.792 bn140516700 0+1+2+9+10 38.144 ± 1.145 -12.544 19.712 ± 0.923 -1.536 bn140516765 3+4+5 22.016 ± 5.425 -2.304 6.912 ± 1.086 3.840 bn140517813 3+4+7+8 18.941 ± 1.618 0.003 6.656 ± 0.572 2.048 bn140518709 8+11 0.704 ± 0.466 -0.640 0.256 ± 0.181 -0.448 bn140519043 9+10+11 47.616 ± 2.721 -22.272 13.824 ± 0.923 -6.144 bn140521184 6+7+9+10+11 46.592 ± 3.328 -5.120 24.832 ± 1.810 2.048

– 134 –

Table 6—Continued

Trigger Detectors T_{90} T_{90} start T_{50} T_{50} start ID Used (s) (s) (s) (s)

bn140521732 6+7+8 11.550 ± 3.595 0.003 5.120 ± 1.145 0.544 bn140523129 3+4+5 19.200 ± 0.362 0.576 9.216 ± 0.362 4.416 bn140526449 3+4+5 79.104 ± 1.379 0.512 40.448 ± 0.724 6.400 bn140526571 0+1+3 0.064 ± 0.834 -0.064 0.064 ± 0.091 -0.064 bn140528837 6+9+10 13.568 ± 0.572 1.024 7.936 ± 0.362 3.840 bn140603476 6+7+8+11 138.242 ± 13.469 -51.201 61.441 ± 2.896 4.096 bn140605377 0+1+3+5+6 0.512 ± 0.320 -0.384 0.128 ± 0.091 -0.064 bn140606133 3+4+6+7+8 22.784 ± 2.064 0.256 4.352 ± 0.572 1.024 bn140608153 0 71.681 ± 7.371 -4.608 26.880 ± 2.919 12.800 bn140608713 8+11 6.400 ± 3.874 -0.256 1.280 ± 0.362 0.256 bn140610487 4+7+8 0.960 ± 0.716 -0.832 0.192 ± 0.466 -0.256 bn140610548 3+4+5 36.865 ± 1.143 0.256 9.472 ± 0.724 11.008 bn140610689 10+11 134.144 ± 7.455 -2.048 57.344 ± 2.896 14.336 bn140612294 6+7+8+11 38.913 ± 8.483 -0.256 11.008 ± 1.864 5.376 bn140616165 0+1+2+3 0.512 ± 0.821 -0.032 0.221 ± 0.202 0.003 bn140619475 6+9+10 2.816 ± 0.810 -0.256 1.024 ± 0.724 0.000 bn140619490 10+11 0.448 ± 0.516 -0.192 0.064 ± 0.272 -0.064 bn140620219 8+11 45.825 ± 12.130 -13.824 7.936 ± 0.724 3.584 bn140621827 1+2+5 6.400 ± 0.810 0.000 5.376 ± 0.572 0.256 bn140623224 0+1+6+9 111.104 ± 3.999 -45.824 57.088 ± 5.526 -21.760 bn140624423 3+4+6+7+8 0.096 ± 0.093 -0.080 0.016 ± 0.045 0.000 bn140626843 4+5 1.792 ± 1.056 -0.256 0.768 ± 0.362 0.000 bn140627401 3+4+5 7.424 ± 2.611 -3.584 3.584 ± 1.619 -2.304 bn140628626 9+10+11 12.544 ± 3.665 -11.776 6.400 ± 1.280 -8.192 bn140628704 8+11 75.520 ± 3.849 -2.304 68.096 ± 1.846 0.512 bn140630505 0+1+3 63.745 ± 2.769 -1.280 33.025 ± 1.493 13.312 bn140701567 6+7+8+11 25.088 ± 3.328 -7.680 8.704 ± 1.056 -0.512 bn140701833 7+8+10+11 6.912 ± 0.923 -1.792 2.048 ± 0.572 2.816 bn140703026 0+1+3 83.969 ± 2.996 0.768 23.808 ± 0.923 8.704 bn140705539 0+1+2+5 26.880 ± 1.557 -3.072 12.288 ± 1.619 0.256 bn140706815 0+1+3 43.776 ± 2.721 -13.824 23.040 ± 12.331 -3.584 bn140709051 8+10+11 69.633 ± 21.549 -25.088 20.480 ± 1.846 -5.632 bn140709637 0+1+2+3+5 156.416 ± 7.940 -131.328 94.208 ± 2.064 -111.360 bn140710537 9+10 0.384 ± 0.091 -0.064 0.192 ± 0.091 0.000 bn140710901 9+10 11.520 ± 4.636 -6.656 5.632 ± 0.923 -3.584 bn140711691 2+10 80.896 ± 21.601 -3.072 32.768 ± 4.344 3.072

– 135 –

aData problems precluded duration analysis. bUsed TTE binned at 32 ms.

cPartial earth occultation is likely; durations are lower limits. dPossible precursor at ∼ T_0 − 120 s.

eData cut off due to SAA entry while burst in progress; durations are lower limits. f SAA entry at T_0 + 83 s; durations are lower limits. gUsed TTE binned at 16 ms. hThis GRB triggered GBM twice.

iToo weak to measure durations; visual duration is ∼ 0.025 s.

jPossible contamination due to emergence of Crab & A0535+26 from Earth occultation. kSolar activity starting at T_0 + 200 s. Post burst background interval was selected before. lData cut off due to SAA entry while burst in progress;it is not possible to determine durations. mSpacecraft in sun pointing mode, detector threshold raised, location of burst nearly in -z direction. The response, peak fluxes and fluence in the 10 − 100 keV energy range have large errors. Fluence, peak fluxes and durations in BATSE energy range (50 -300 keV) are reliable.

nLocalization of precursor at T_0 − 120 s is consistent with burst location and was included in the duration analysis.

oSAA entry at T_0 + 100 s; durations are lower limits.

pTTE/CTTE data not available, 64 ms peak fluxes may not be correct.

– 136 –

Table 7. GRB Fluence & Peak Flux (10–1000 keV)

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn080714086 6.76E-07 ± 4.07E-08 3.82 ± 1.06 2.24 ± 0.36 1.54 ± 0.18 bn080714425 1.81E-06 ± 2.09E-08 4.00 ± 1.45 2.96 ± 0.46 2.02 ± 0.21 bn080714745 6.33E-06 ± 1.41E-07 8.89 ± 1.61 7.78 ± 0.83 6.93 ± 0.39 bn080715950 5.04E-06 ± 7.95E-08 19.42 ± 0.95 13.58 ± 0.45 9.91 ± 0.22 bn080717543 4.46E-06 ± 7.68E-08 6.24 ± 1.08 3.43 ± 0.49 2.89 ± 0.23 bn080719529 7.75E-07 ± 2.93E-08 2.77 ± 0.83 1.77 ± 0.29 1.12 ± 0.16 bn080720316 7.75E-07 ± 2.93E-08 2.77 ± 0.83 1.77 ± 0.29 1.12 ± 0.16 bn080723557 7.22E-05 ± 2.54E-07 40.97 ± 2.24 38.24 ± 1.09 30.45 ± 0.49 bn080723913 1.34E-07 ± 1.36E-08 5.26 ± 0.70 4.13 ± 0.32 1.41 ± 0.13 bn080723985 3.08E-05 ± 2.07E-07 13.45 ± 1.24 11.36 ± 0.60 10.12 ± 0.28 bn080724401 1.57E-05 ± 5.04E-08 22.73 ± 1.31 18.98 ± 0.62 12.20 ± 0.29 bn080725435 7.99E-06 ± 4.42E-08 5.38 ± 0.77 4.28 ± 0.38 3.36 ± 0.17 bn080725541 4.92E-07 ± 4.39E-08 6.27 ± 0.78 5.13 ± 0.36 1.69 ± 0.13 bn080727964 1.33E-05 ± 7.91E-08 6.44 ± 0.92 4.17 ± 0.42 3.53 ± 0.18 bn080730520 4.87E-06 ± 9.89E-08 7.83 ± 1.03 6.34 ± 0.46 5.60 ± 0.22 bn080730786 6.35E-06 ± 8.31E-08 16.89 ± 0.94 16.44 ± 0.45 14.61 ± 0.23 bn080802386 3.98E-07 ± 6.85E-09 10.41 ± 1.12 7.06 ± 0.35 2.95 ± 0.17 bn080803772 4.39E-06 ± 7.43E-08 3.37 ± 0.67 2.26 ± 0.26 1.78 ± 0.11 bn080804456 8.00E-06 ± 8.65E-08 3.96 ± 0.68 2.80 ± 0.34 1.94 ± 0.14 bn080804972 9.13E-06 ± 1.06E-07 5.81 ± 0.76 4.40 ± 0.36 3.85 ± 0.16 bn080805496 1.75E-06 ± 4.78E-08 4.77 ± 1.07 3.92 ± 0.53 3.05 ± 0.23 bn080805584 4.38E-06 ± 6.45E-08 4.55 ± 1.32 3.03 ± 0.48 1.77 ± 0.17 bn080806584 4.31E-07 ± 2.50E-08 4.33 ± 0.83 2.84 ± 0.32 2.39 ± 0.16 bn080806896 1.33E-05 ± 1.94E-07 11.20 ± 0.94 9.32 ± 0.43 8.18 ± 0.21 bn080807993 7.30E-06 ± 9.01E-08 19.42 ± 0.82 15.24 ± 0.39 8.88 ± 0.18 bn080808451 7.10E-07 ± 3.96E-08 2.70 ± 0.69 2.33 ± 0.30 1.75 ± 0.14 bn080808565 3.97E-06 ± 4.22E-08 7.79 ± 0.87 6.81 ± 0.50 5.98 ± 0.22 bn080808772 7.07E-06 ± 7.87E-08 4.02 ± 0.72 3.12 ± 0.26 1.90 ± 0.13 bn080809808 4.14E-06 ± 5.50E-08 9.19 ± 1.42 5.29 ± 0.62 3.76 ± 0.27 bn080810549 1.08E-05 ± 4.81E-08 6.76 ± 1.26 4.85 ± 0.59 3.57 ± 0.21 bn080812889 2.45E-06 ± 4.18E-08 5.20 ± 0.95 2.90 ± 0.44 1.91 ± 0.17 bn080815917 4.69E-07 ± 2.73E-08 6.26 ± 0.97 4.58 ± 0.43 3.26 ± 0.21

– 137 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn080816503 1.33E-05 ± 8.25E-08 9.90 ± 0.76 8.91 ± 0.37 7.44 ± 0.18 bn080816989 3.30E-06 ± 9.24E-08 9.27 ± 0.62 7.19 ± 0.29 5.21 ± 0.13 bn080817161 5.32E-05 ± 7.31E-08 17.44 ± 1.04 14.65 ± 0.52 13.67 ± 0.24 bn080817720 1.82E-06 ± 4.14E-08 7.93 ± 0.92 5.24 ± 0.47 3.59 ± 0.21 bn080818579 3.80E-06 ± 5.83E-08 7.34 ± 0.85 6.32 ± 0.40 4.58 ± 0.19 bn080818945 1.74E-06 ± 2.44E-08 6.22 ± 0.89 5.08 ± 0.33 4.01 ± 0.19 bn080821332 3.59E-06 ± 1.76E-08 11.42 ± 1.11 10.72 ± 0.59 9.64 ± 0.27 bn080823363 5.55E-06 ± 3.57E-08 6.72 ± 0.90 5.60 ± 0.48 4.62 ± 0.21 bn080824909 2.73E-06 ± 5.91E-08 12.87 ± 0.98 11.20 ± 0.52 7.26 ± 0.23 bn080825593 3.42E-05 ± 9.70E-08 31.30 ± 1.12 29.43 ± 0.60 25.30 ± 0.27 bn080828189 4.11E-07 ± 1.68E-08 5.62 ± 0.98 2.84 ± 0.35 1.40 ± 0.15 bn080829790 2.52E-06 ± 2.18E-08 7.05 ± 1.29 5.33 ± 0.48 4.48 ± 0.24 bn080830368 7.00E-06 ± 1.10E-07 6.49 ± 0.80 5.33 ± 0.37 4.67 ± 0.18 bn080831053 5.62E-08 ± 1.74E-08 4.66 ± 1.10 1.12 ± 0.46 0.33 ± 0.20 bn080831921 8.47E-06 ± 4.02E-08 5.54 ± 1.12 3.96 ± 0.50 2.85 ± 0.21 bn080904886 5.24E-06 ± 7.07E-08 19.16 ± 1.23 17.39 ± 0.58 15.84 ± 0.27 bn080905499 8.50E-07 ± 4.62E-08 6.32 ± 0.68 4.70 ± 0.31 2.34 ± 0.14 bn080905570 4.09E-06 ± 5.63E-08 8.14 ± 1.33 6.95 ± 0.60 5.36 ± 0.27 bn080905705 2.91E-06 ± 3.63E-08 4.08 ± 1.10 3.30 ± 0.40 2.32 ± 0.23 bn080906212 5.87E-06 ± 1.39E-07 24.84 ± 1.45 22.88 ± 0.69 20.29 ± 0.33 bn080912360 2.13E-06 ± 2.97E-08 4.82 ± 0.70 3.01 ± 0.28 2.48 ± 0.15 bn080913735 3.54E-06 ± 8.67E-08 5.99 ± 0.88 4.88 ± 0.40 3.40 ± 0.18 bn080916009 6.03E-05 ± 7.00E-08 16.40 ± 1.65 15.09 ± 0.64 13.66 ± 0.29 bn080916406 7.81E-06 ± 8.18E-08 7.10 ± 1.35 5.56 ± 0.32 4.47 ± 0.29 bn080919790 4.59E-08 ± 5.06E-09 4.56 ± 1.14 2.51 ± 0.47 0.68 ± 0.18 bn080920268 1.87E-06 ± 6.34E-08 3.49 ± 0.78 1.61 ± 0.26 1.08 ± 0.11 bn080924766 4.73E-06 ± 7.87E-08 6.74 ± 0.84 5.79 ± 0.41 4.76 ± 0.19 bn080925775 1.85E-05 ± 4.00E-08 17.21 ± 1.00 15.80 ± 0.50 15.40 ± 0.24 bn080927480 2.96E-06 ± 9.64E-08 4.99 ± 1.33 3.38 ± 0.49 2.63 ± 0.25 bn080928628 1.16E-06 ± 3.76E-08 6.02 ± 1.27 5.10 ± 0.51 3.19 ± 0.23 bn081003644 9.00E-06 ± 1.08E-07 5.21 ± 0.96 4.29 ± 0.46 3.07 ± 0.22 bn081006604 8.33E-07 ± 1.87E-08 4.69 ± 1.20 3.28 ± 0.61 1.46 ± 0.25

– 138 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn081006872 3.87E-07 ± 2.02E-08 3.93 ± 1.20 3.01 ± 0.57 1.53 ± 0.25 bn081008832 1.03E-05 ± 1.50E-07 5.33 ± 0.79 3.45 ± 0.34 2.66 ± 0.16 bn081009140 3.83E-05 ± 4.53E-08 129.89 ± 2.49 125.99 ± 1.24 117.01 ± 0.62 bn081009690 1.08E-05 ± 7.57E-08 9.35 ± 1.09 6.44 ± 0.48 5.98 ± 0.23 bn081012045 2.29E-07 ± 4.36E-08 6.27 ± 1.23 4.69 ± 0.55 3.33 ± 0.26 bn081012549 4.51E-06 ± 1.12E-07 4.76 ± 0.80 2.62 ± 0.31 2.05 ± 0.13 bn081017474 1.39E-06 ± 2.10E-08 4.63 ± 1.24 4.00 ± 0.57 2.75 ± 0.25 bn081021398 5.74E-06 ± 7.90E-08 5.88 ± 0.95 4.07 ± 0.60 3.53 ± 0.23 bn081022364 1.16E-06 ± 2.90E-08 4.71 ± 1.21 2.83 ± 0.49 2.16 ± 0.23 bn081024245 1.99E-07 ± 1.69E-08 6.80 ± 1.38 4.07 ± 0.66 1.85 ± 0.29 bn081024851 6.27E-06 ± 7.17E-08 4.58 ± 0.89 3.12 ± 0.28 2.37 ± 0.18 bn081024891 3.55E-07 ± 2.86E-08 5.36 ± 0.56 3.45 ± 0.28 2.14 ± 0.14 bn081025349 6.32E-06 ± 1.18E-07 5.10 ± 0.69 4.78 ± 0.36 4.09 ± 0.17 bn081028538 2.27E-06 ± 2.59E-08 8.12 ± 0.94 7.55 ± 0.45 6.34 ± 0.22 bn081101167 1.39E-06 ± 6.23E-08 4.16 ± 1.44 2.39 ± 0.58 1.36 ± 0.24 bn081101491 1.68E-07 ± 3.64E-09 7.97 ± 0.80 4.48 ± 0.37 1.06 ± 0.15 bn081101532 1.51E-05 ± 3.46E-07 12.96 ± 1.29 11.30 ± 0.64 9.75 ± 0.31 bn081102365 1.09E-06 ± 3.23E-08 5.06 ± 0.57 3.87 ± 0.29 2.64 ± 0.14 bn081102739 3.76E-06 ± 9.19E-08 4.47 ± 0.84 3.64 ± 0.34 2.71 ± 0.16 bn081105614 2.75E-07 ± 1.84E-08 7.95 ± 1.02 2.91 ± 0.46 0.81 ± 0.18 bn081107321 1.22E-06 ± 3.19E-08 13.54 ± 0.85 11.98 ± 0.40 9.96 ± 0.19 bn081109293 6.55E-06 ± 5.87E-08 4.37 ± 1.59 3.24 ± 0.20 2.64 ± 0.16 bn081110601 5.41E-06 ± 1.01E-07 21.19 ± 1.19 20.58 ± 0.58 15.38 ± 0.27 bn081113230 3.30E-07 ± 4.30E-08 11.14 ± 0.99 8.14 ± 0.47 3.01 ± 0.18 bn081115891 8.56E-08 ± 1.31E-08 3.75 ± 0.76 2.18 ± 0.38 1.02 ± 0.18 bn081118876 4.94E-06 ± 4.43E-08 9.58 ± 0.88 8.02 ± 0.42 7.29 ± 0.19 bn081119184 1.30E-07 ± 1.76E-08 4.80 ± 1.25 3.29 ± 0.56 1.40 ± 0.23 bn081120618 1.94E-06 ± 2.42E-08 6.27 ± 1.31 5.16 ± 0.61 4.25 ± 0.28 bn081121858 1.53E-05 ± 2.20E-07 12.81 ± 1.66 10.37 ± 0.75 7.72 ± 0.38 bn081122520 7.54E-06 ± 7.85E-08 21.51 ± 1.11 17.92 ± 0.52 12.19 ± 0.24 bn081122614 1.39E-07 ± 7.95E-09 9.21 ± 1.43 7.01 ± 0.52 1.70 ± 0.20 bn081124060 8.59E-06 ± 7.98E-08 21.66 ± 1.20 21.34 ± 0.41 19.78 ± 0.25

– 139 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn081125496 1.85E-05 ± 1.33E-07 27.56 ± 1.91 26.38 ± 0.91 23.25 ± 0.43 bn081126899 1.14E-05 ± 6.66E-08 7.77 ± 0.81 7.19 ± 0.39 6.50 ± 0.19 bn081129161 1.62E-05 ± 1.47E-07 19.58 ± 1.38 17.24 ± 0.66 14.30 ± 0.31 bn081130212 2.64E-07 ± 2.05E-08 11.28 ± 1.75 5.13 ± 0.57 2.17 ± 0.23 bn081130629 3.22E-06 ± 5.55E-08 6.17 ± 0.85 5.15 ± 0.41 4.37 ± 0.19 bn081204004 1.02E-06 ± 5.39E-08 5.00 ± 0.66 3.82 ± 0.30 3.01 ± 0.15 bn081204517 3.11E-07 ± 1.74E-08 10.91 ± 0.83 6.66 ± 0.36 1.97 ± 0.13 bn081206275 3.86E-06 ± 6.49E-08 4.28 ± 0.96 3.12 ± 0.35 2.15 ± 0.17 bn081206604 5.00E-07 ± 3.66E-08 3.02 ± 1.06 2.24 ± 0.34 1.90 ± 0.21 bn081206987 1.13E-06 ± 3.49E-08 2.91 ± 0.93 2.32 ± 0.46 1.66 ± 0.19 bn081207680 4.86E-05 ± 9.84E-08 6.22 ± 0.79 5.16 ± 0.37 4.43 ± 0.17 bn081209981 1.47E-06 ± 1.49E-08 25.43 ± 1.21 14.91 ± 0.54 4.28 ± 0.22 bn081213173 1.23E-07 ± 1.87E-08 4.92 ± 0.94 2.98 ± 0.38 0.99 ± 0.16 bn081215784 5.47E-05 ± 5.87E-08 148.47 ± 2.13 122.54 ± 1.00 64.91 ± 0.39 bn081215880 1.78E-06 ± 3.58E-08 7.09 ± 2.33 5.58 ± 0.87 4.56 ± 0.42 bn081216531 2.99E-06 ± 7.74E-08 38.22 ± 1.27 26.99 ± 0.57 8.92 ± 0.21 bn081217983 9.62E-06 ± 1.40E-07 6.90 ± 0.71 6.07 ± 0.34 5.47 ± 0.16 bn081221681 3.00E-05 ± 8.69E-08 27.48 ± 1.36 26.87 ± 0.67 25.43 ± 0.33 bn081222204 1.19E-05 ± 9.57E-08 14.50 ± 1.00 13.75 ± 0.48 12.76 ± 0.23 bn081223419 8.34E-07 ± 3.86E-08 14.73 ± 0.86 12.81 ± 0.42 6.05 ± 0.18 bn081224887 3.76E-05 ± 1.69E-07 26.67 ± 1.15 24.65 ± 0.57 23.85 ± 0.28 bn081225257 6.75E-06 ± 8.95E-08 3.73 ± 0.68 2.73 ± 0.31 2.15 ± 0.15 bn081226044 4.30E-07 ± 2.32E-08 6.23 ± 1.37 5.32 ± 0.72 2.32 ± 0.28 bn081226156 3.95E-06 ± 1.95E-08 6.41 ± 0.86 4.84 ± 0.40 3.74 ± 0.19 bn081226509 3.44E-07 ± 2.71E-08 8.53 ± 0.78 5.60 ± 0.33 1.69 ± 0.13 bn081229187 1.06E-06 ± 7.66E-08 5.00 ± 0.60 4.44 ± 0.29 1.88 ± 0.12 bn081229675 1.06E-06 ± 7.66E-08 5.00 ± 0.60 4.44 ± 0.29 1.88 ± 0.12 bn081230871 1.81E-07 ± 1.60E-08 3.84 ± 0.62 2.24 ± 0.30 1.27 ± 0.15 bn081231140 1.61E-05 ± 1.17E-07 17.44 ± 1.05 15.05 ± 0.50 11.21 ± 0.23 bn090101758 1.23E-05 ± 1.14E-07 14.10 ± 1.24 12.41 ± 0.56 11.66 ± 0.28 bn090102122 2.79E-05 ± 6.10E-08 19.97 ± 0.97 17.20 ± 0.47 11.17 ± 0.21 bn090107681 2.90E-06 ± 1.02E-07 6.84 ± 1.63 5.03 ± 0.60 3.13 ± 0.32

– 140 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090108020 7.47E-07 ± 1.66E-08 25.43 ± 1.36 18.64 ± 0.62 7.91 ± 0.25 bn090108322 5.36E-07 ± 1.41E-08 10.33 ± 1.03 7.16 ± 0.42 1.97 ± 0.20 bn090109332 2.09E-07 ± 2.31E-08 4.34 ± 1.17 3.14 ± 0.48 1.83 ± 0.22 bn090112332 3.92E-06 ± 6.84E-08 7.50 ± 1.52 6.53 ± 0.74 6.03 ± 0.30 bn090112729 9.23E-06 ± 1.08E-07 18.12 ± 1.32 16.05 ± 0.63 13.26 ± 0.30 bn090113778 1.57E-06 ± 4.83E-08 6.12 ± 0.71 5.30 ± 0.36 3.77 ± 0.16 bn090117335 1.10E-06 ± 3.50E-08 5.38 ± 1.40 4.37 ± 0.50 3.67 ± 0.27 bn090117632 1.19E-05 ± 1.97E-07 5.71 ± 0.82 3.66 ± 0.40 3.28 ± 0.18 bn090117640 2.53E-06 ± 4.70E-08 16.83 ± 0.95 15.38 ± 0.49 10.22 ± 0.21 bn090120627 7.68E-07 ± 2.08E-08 4.66 ± 0.77 2.92 ± 0.30 1.84 ± 0.15 bn090126227 1.10E-06 ± 2.02E-08 5.52 ± 0.78 4.48 ± 0.38 4.02 ± 0.18 bn090126245 3.58E-07 ± 1.93E-08 3.59 ± 0.48 2.10 ± 0.23 1.37 ± 0.11 bn090129880 5.57E-06 ± 6.20E-08 9.78 ± 1.01 7.14 ± 0.43 6.60 ± 0.22 bn090131090 1.75E-05 ± 6.57E-08 59.41 ± 1.95 55.09 ± 0.94 40.31 ± 0.42 bn090202347 4.95E-06 ± 3.10E-08 7.28 ± 0.84 6.43 ± 0.40 5.75 ± 0.21 bn090206620 7.15E-07 ± 1.22E-08 12.70 ± 1.07 8.48 ± 0.53 2.55 ± 0.21 bn090207777 2.41E-06 ± 4.17E-08 3.67 ± 1.06 3.38 ± 0.53 2.79 ± 0.22 bn090213236 1.10E-06 ± 5.82E-08 3.67 ± 1.40 2.16 ± 0.44 1.26 ± 0.22 bn090217206 2.75E-05 ± 3.19E-08 13.06 ± 1.05 10.91 ± 0.52 9.74 ± 0.25 bn090219074 2.12E-07 ± 5.42E-08 11.66 ± 3.09 6.88 ± 1.42 3.18 ± 0.60 bn090222179 3.23E-06 ± 5.38E-08 4.93 ± 0.85 3.61 ± 0.38 3.01 ± 0.17 bn090225009 1.54E-07 ± 1.52E-08 4.64 ± 1.53 3.48 ± 0.38 1.44 ± 0.28 bn090227310 2.86E-06 ± 2.08E-08 6.67 ± 1.21 4.68 ± 0.48 3.94 ± 0.27 bn090227772 7.86E-06 ± 4.06E-08 113.03 ± 14.14 59.40 ± 3.62 16.98 ± 0.93 bn090228204 6.19E-06 ± 2.65E-08 134.01 ± 2.74 54.58 ± 0.96 16.89 ± 0.32 bn090228976 9.64E-07 ± 6.58E-08 3.94 ± 1.21 2.96 ± 0.46 2.28 ± 0.24 bn090301315 2.27E-06 ± 3.78E-08 5.01 ± 0.81 4.07 ± 0.38 3.72 ± 0.18 bn090304216 8.99E-07 ± 1.02E-07 3.40 ± 0.52 2.74 ± 0.36 1.91 ± 0.16 bn090305052 1.94E-06 ± 1.33E-08 9.05 ± 0.58 8.04 ± 0.29 5.20 ± 0.15 bn090306245 1.37E-06 ± 3.70E-08 3.59 ± 0.98 2.21 ± 0.45 1.72 ± 0.22 bn090307167 1.09E-06 ± 3.69E-08 3.97 ± 1.36 2.66 ± 0.44 1.41 ± 0.24 bn090308734 2.55E-06 ± 2.89E-08 12.33 ± 0.71 8.50 ± 0.36 6.56 ± 0.17

– 141 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090309767 4.42E-06 ± 6.88E-08 5.19 ± 1.81 4.45 ± 0.44 3.46 ± 0.21 bn090310189 5.54E-06 ± 6.20E-08 5.27 ± 0.94 4.16 ± 0.41 3.43 ± 0.20 bn090316311 1.06E-06 ± 2.21E-08 10.32 ± 1.28 7.60 ± 0.71 3.79 ± 0.31 bn090319622 6.03E-06 ± 6.50E-08 5.81 ± 1.37 4.37 ± 0.63 3.57 ± 0.28 bn090320045 4.45E-07 ± 2.31E-08 2.80 ± 0.65 1.87 ± 0.27 1.42 ± 0.13 bn090320418 1.00E-06 ± 3.85E-08 4.17 ± 0.80 2.15 ± 0.31 1.60 ± 0.14 bn090320801 1.67E-06 ± 6.16E-08 6.10 ± 1.39 4.98 ± 0.43 4.36 ± 0.25 bn090323002 1.18E-04 ± 1.74E-07 14.33 ± 0.84 13.38 ± 0.44 12.65 ± 0.22 bn090326633 1.70E-06 ± 6.37E-08 7.15 ± 1.03 5.80 ± 0.45 4.90 ± 0.22 bn090327404 2.82E-06 ± 6.06E-08 4.64 ± 0.79 3.66 ± 0.36 3.04 ± 0.18 bn090328401 4.20E-05 ± 6.53E-08 25.35 ± 1.50 21.95 ± 0.70 17.23 ± 0.33 bn090328713 1.19E-07 ± 1.84E-08 17.35 ± 1.45 8.17 ± 0.59 1.97 ± 0.22 bn090330279 1.18E-05 ± 4.05E-08 7.49 ± 0.85 6.35 ± 0.36 5.54 ± 0.18 bn090331681 3.45E-07 ± 3.46E-08 7.19 ± 0.82 4.01 ± 0.35 1.97 ± 0.16 bn090403314 1.09E-06 ± 1.93E-08 3.02 ± 1.08 2.43 ± 0.42 1.82 ± 0.21 bn090405663 2.54E-07 ± 3.10E-08 6.73 ± 1.08 3.91 ± 0.45 1.16 ± 0.18 bn090409288 1.13E-06 ± 5.94E-08 3.69 ± 0.79 2.11 ± 0.27 1.60 ± 0.14 bn090411838 6.67E-06 ± 1.03E-07 8.77 ± 1.06 6.96 ± 0.49 5.24 ± 0.23 bn090411991 6.21E-06 ± 8.85E-08 7.96 ± 1.11 6.34 ± 0.55 4.72 ± 0.25 bn090412061 1.25E-07 ± 1.36E-08 4.12 ± 1.20 3.29 ± 0.50 0.87 ± 0.20 bn090413122 3.23E-06 ± 4.92E-08 4.42 ± 0.64 3.90 ± 0.34 3.04 ± 0.17 bn090418816 1.82E-07 ± 3.26E-08 5.88 ± 1.27 3.60 ± 0.54 1.68 ± 0.24 bn090419997 9.54E-06 ± 2.38E-07 5.77 ± 0.83 4.68 ± 0.38 4.13 ± 0.18 bn090422150 4.59E-07 ± 3.44E-08 4.94 ± 1.31 3.74 ± 0.50 2.37 ± 0.24 bn090423330 8.16E-07 ± 7.15E-08 4.24 ± 1.22 2.30 ± 0.48 1.62 ± 0.21 bn090424592 4.63E-05 ± 3.86E-08 126.67 ± 2.04 121.25 ± 0.99 109.51 ± 0.49 bn090425377 1.81E-05 ± 1.52E-07 18.63 ± 1.65 17.15 ± 0.89 13.88 ± 0.42 bn090426066 6.77E-07 ± 4.37E-08 3.21 ± 0.86 2.63 ± 0.41 2.03 ± 0.18 bn090426690 3.54E-06 ± 8.82E-08 9.16 ± 0.86 7.13 ± 0.41 6.31 ± 0.19 bn090427644 2.65E-07 ± 2.22E-08 2.97 ± 0.82 2.30 ± 0.33 1.71 ± 0.15 bn090427688 1.62E-06 ± 3.18E-08 5.03 ± 1.09 3.59 ± 0.52 2.55 ± 0.24 bn090428441 1.04E-06 ± 6.27E-08 9.21 ± 1.05 8.44 ± 0.52 6.29 ± 0.25

– 142 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090428552 5.60E-06 ± 1.24E-07 9.87 ± 1.16 8.74 ± 0.48 7.61 ± 0.24 bn090429530 4.36E-06 ± 1.38E-07 6.44 ± 1.07 4.02 ± 0.49 3.28 ± 0.22 bn090429753 1.12E-06 ± 4.33E-08 8.62 ± 0.83 7.53 ± 0.35 3.90 ± 0.15 bn090502777 3.50E-06 ± 2.85E-08 8.79 ± 1.58 6.89 ± 0.70 5.28 ± 0.33 bn090509215 5.42E-06 ± 7.36E-08 3.86 ± 0.87 2.79 ± 0.32 2.32 ± 0.17 bn090510016 3.37E-06 ± 4.06E-08 40.95 ± 1.58 22.99 ± 0.75 9.10 ± 0.24 bn090510325 5.60E-07 ± 2.75E-08 3.14 ± 1.21 2.52 ± 0.42 1.81 ± 0.25 bn090511684 2.49E-06 ± 8.47E-08 5.56 ± 0.80 4.30 ± 0.40 3.46 ± 0.19 bn090513916 4.94E-06 ± 1.77E-07 4.87 ± 1.03 3.53 ± 0.41 2.12 ± 0.17 bn090513941 1.04E-06 ± 3.01E-08 5.21 ± 1.86 3.99 ± 0.75 2.40 ± 0.36 bn090514006 6.46E-06 ± 1.07E-07 7.80 ± 0.80 7.04 ± 0.42 6.01 ± 0.20 bn090514726 2.25E-06 ± 3.13E-08 13.46 ± 1.12 12.24 ± 0.57 7.98 ± 0.26 bn090514734 9.55E-06 ± 2.10E-07 6.88 ± 1.15 6.50 ± 0.32 4.56 ± 0.22 bn090516137 1.68E-05 ± 1.85E-07 4.58 ± 0.84 3.65 ± 0.33 3.02 ± 0.17 bn090516353 1.72E-05 ± 5.60E-08 7.54 ± 1.10 5.14 ± 0.40 4.41 ± 0.22 bn090516853 5.00E-06 ± 9.59E-08 10.02 ± 1.07 9.28 ± 0.49 7.98 ± 0.24 bn090518080 9.91E-07 ± 2.67E-08 9.75 ± 5.05 5.68 ± 0.67 4.75 ± 0.31 bn090518244 2.11E-06 ± 6.83E-08 7.10 ± 1.02 5.96 ± 0.45 4.96 ± 0.22 bn090519462 4.38E-06 ± 5.13E-08 6.53 ± 1.10 4.37 ± 0.45 2.57 ± 0.18 bn090519881 5.73E-06 ± 6.12E-08 3.45 ± 0.96 2.31 ± 0.32 1.49 ± 0.16 bn090520832 2.32E-07 ± 2.52E-08 5.76 ± 1.01 3.83 ± 0.43 2.03 ± 0.19 bn090520850 3.32E-06 ± 1.04E-07 9.53 ± 1.06 6.74 ± 0.43 5.23 ± 0.21 bn090520876 6.18E-06 ± 3.88E-08 10.80 ± 1.06 9.41 ± 0.46 8.80 ± 0.23 bn090522344 2.13E-06 ± 4.94E-08 6.06 ± 0.81 4.18 ± 0.42 3.48 ± 0.20 bn090524346 1.66E-05 ± 6.07E-08 14.50 ± 0.93 14.08 ± 0.45 12.97 ± 0.22 bn090528173 6.56E-06 ± 1.14E-07 7.67 ± 0.89 5.54 ± 0.43 4.75 ± 0.20 bn090528516 4.35E-05 ± 8.85E-08 19.32 ± 0.94 17.28 ± 0.45 12.76 ± 0.21 bn090529310 8.34E-07 ± 3.71E-08 5.71 ± 0.75 3.68 ± 0.31 3.28 ± 0.16 bn090529564 8.69E-06 ± 3.33E-08 30.71 ± 1.19 27.27 ± 0.58 22.56 ± 0.27 bn090530760 5.99E-05 ± 1.60E-07 12.75 ± 1.12 11.78 ± 0.51 10.70 ± 0.24 bn090531775 3.18E-07 ± 1.84E-08 5.92 ± 1.15 4.02 ± 0.47 3.40 ± 0.25 bn090602564 2.79E-06 ± 5.69E-08 5.07 ± 1.47 3.64 ± 0.52 2.51 ± 0.32

– 143 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090606471 9.46E-07 ± 8.74E-08 5.79 ± 1.80 2.51 ± 0.48 1.60 ± 0.22 bn090608052 1.24E-06 ± 1.75E-08 4.32 ± 0.82 2.99 ± 0.36 2.25 ± 0.17 bn090610648 1.35E-06 ± 5.64E-08 4.60 ± 0.74 3.41 ± 0.33 2.95 ± 0.15 bn090610723 3.96E-06 ± 6.07E-08 3.82 ± 1.46 3.01 ± 0.51 2.22 ± 0.26 bn090610883 7.64E-07 ± 2.24E-08 4.34 ± 1.32 2.98 ± 0.52 2.08 ± 0.27 bn090612619 5.82E-06 ± 7.46E-08 7.78 ± 1.03 6.47 ± 0.47 6.05 ± 0.23 bn090616157 4.13E-07 ± 2.26E-08 4.06 ± 0.72 3.55 ± 0.33 2.62 ± 0.15 bn090617208 9.43E-07 ± 1.66E-08 18.94 ± 0.81 11.20 ± 0.38 2.93 ± 0.14 bn090618353 2.68E-04 ± 4.29E-07 76.16 ± 4.75 72.00 ± 2.32 68.72 ± 1.14 bn090620400 1.33E-05 ± 4.27E-08 19.08 ± 1.30 17.66 ± 0.59 15.43 ± 0.29 bn090620901 4.31E-07 ± 3.23E-08 3.93 ± 0.71 2.78 ± 0.35 2.08 ± 0.14 bn090621185 1.08E-05 ± 2.11E-07 5.96 ± 0.86 4.52 ± 0.42 3.63 ± 0.19 bn090621417 3.82E-06 ± 1.10E-07 6.45 ± 0.80 4.64 ± 0.37 3.67 ± 0.37 bn090621447 1.57E-06 ± 5.25E-08 5.71 ± 1.16 3.75 ± 0.49 2.84 ± 0.22 bn090621922 4.76E-07 ± 1.94E-08 9.79 ± 1.50 5.58 ± 0.69 2.02 ± 0.28 bn090623107 1.18E-05 ± 7.15E-08 8.53 ± 0.75 8.16 ± 0.38 6.22 ± 0.18 bn090623913 2.16E-06 ± 5.54E-08 5.41 ± 1.30 4.10 ± 0.47 3.60 ± 0.24 bn090625234 1.35E-06 ± 1.28E-08 3.68 ± 2.08 2.11 ± 0.57 1.43 ± 0.13 bn090625560 2.46E-06 ± 8.72E-08 6.22 ± 1.37 4.13 ± 0.56 3.44 ± 0.26 bn090626189 6.30E-05 ± 1.07E-07 53.30 ± 2.86 44.46 ± 1.34 34.25 ± 0.64 bn090626707 6.30E-05 ± 1.07E-07 53.30 ± 2.86 44.46 ± 1.34 34.25 ± 0.64 bn090629543 4.39E-07 ± 2.48E-08 3.11 ± 0.92 2.20 ± 0.40 1.07 ± 0.21 bn090630311 1.08E-06 ± 1.25E-08 7.65 ± 0.83 6.86 ± 0.42 6.19 ± 0.21 bn090701225 4.42E-07 ± 1.58E-08 5.38 ± 0.81 4.54 ± 0.40 3.14 ± 0.18 bn090703329 8.46E-07 ± 2.88E-08 3.79 ± 1.12 3.08 ± 0.34 2.46 ± 0.21 bn090704242 8.48E-06 ± 9.96E-08 5.69 ± 1.88 3.58 ± 0.47 2.57 ± 0.21 bn090704783 1.58E-06 ± 4.42E-08 5.12 ± 1.26 3.52 ± 0.58 3.03 ± 0.26 bn090706283 7.47E-06 ± 7.61E-08 6.40 ± 1.77 4.15 ± 0.52 3.07 ± 0.24 bn090708152 1.01E-06 ± 2.76E-08 3.33 ± 0.94 1.83 ± 0.38 1.37 ± 0.16 bn090709630 2.21E-06 ± 3.91E-08 5.11 ± 0.75 4.08 ± 0.33 3.39 ± 0.15 bn090711850 5.79E-06 ± 1.31E-07 5.84 ± 1.03 4.62 ± 0.46 3.60 ± 0.21 bn090712160 7.60E-06 ± 2.59E-07 3.82 ± 0.82 2.05 ± 0.34 1.60 ± 0.15

– 144 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090713020 9.48E-06 ± 4.45E-08 5.43 ± 0.88 4.30 ± 0.41 3.30 ± 0.17 bn090717034 2.32E-05 ± 7.46E-08 19.76 ± 1.01 19.12 ± 0.50 16.53 ± 0.24 bn090717111 3.08E-07 ± 2.59E-08 4.18 ± 0.80 3.19 ± 0.30 1.61 ± 0.13 bn090718720 3.32E-06 ± 4.42E-08 5.42 ± 1.34 2.58 ± 0.44 1.73 ± 0.20 bn090718762 2.50E-05 ± 1.19E-07 32.18 ± 1.33 30.80 ± 0.68 28.99 ± 0.33 bn090719063 4.68E-05 ± 1.58E-07 41.57 ± 1.61 39.10 ± 0.79 37.81 ± 0.39 bn090720276 3.22E-06 ± 2.95E-08 14.07 ± 1.45 11.28 ± 0.66 10.18 ± 0.31 bn090720710 1.42E-05 ± 2.37E-08 34.19 ± 1.53 29.83 ± 0.71 9.91 ± 0.24 bn090725838 2.36E-06 ± 4.69E-08 5.74 ± 1.13 4.80 ± 0.47 4.00 ± 0.24 bn090726218 5.22E-07 ± 2.06E-08 3.07 ± 0.93 1.98 ± 0.31 1.31 ± 0.20 bn090730608 3.18E-06 ± 7.55E-08 6.58 ± 0.88 5.63 ± 0.41 4.88 ± 0.19 bn090802235 1.14E-06 ± 3.58E-08 35.46 ± 1.75 21.08 ± 0.58 5.49 ± 0.20 bn090802666 2.77E-06 ± 6.80E-08 6.27 ± 1.05 6.27 ± 0.26 3.65 ± 0.19 bn090804940 1.44E-05 ± 1.86E-07 40.69 ± 1.68 38.27 ± 0.80 36.65 ± 0.41 bn090805622 5.79E-06 ± 4.96E-08 7.36 ± 1.62 5.87 ± 0.73 4.52 ± 0.36 bn090807832 1.34E-06 ± 2.54E-08 15.82 ± 1.31 13.76 ± 0.63 9.31 ± 0.28 bn090809978 2.16E-05 ± 1.28E-07 24.93 ± 1.16 23.81 ± 0.59 22.96 ± 0.29 bn090810659 9.89E-06 ± 8.75E-08 10.06 ± 1.65 8.40 ± 0.72 7.45 ± 0.33 bn090810781 5.15E-06 ± 5.73E-08 6.84 ± 1.00 4.38 ± 0.45 3.41 ± 0.20 bn090811696 1.05E-06 ± 2.24E-08 5.07 ± 1.11 3.46 ± 0.41 2.22 ± 0.20 bn090813174 3.33E-06 ± 4.15E-08 24.15 ± 1.10 19.30 ± 0.53 13.64 ± 0.25 bn090814368 8.90E-07 ± 6.06E-09 11.43 ± 0.63 8.96 ± 0.32 2.42 ± 0.12 bn090814950 1.60E-05 ± 3.87E-07 6.58 ± 0.96 5.04 ± 0.44 4.29 ± 0.21 bn090815300 1.43E-06 ± 4.44E-08 4.50 ± 1.47 2.67 ± 0.51 1.59 ± 0.26 bn090815438 4.89E-06 ± 1.60E-07 14.18 ± 1.17 11.80 ± 0.50 11.36 ± 0.28 bn090815946 2.88E-06 ± 2.76E-08 3.30 ± 1.01 2.14 ± 0.41 1.47 ± 0.19 bn090817036 4.61E-06 ± 1.07E-07 5.50 ± 1.28 4.51 ± 0.55 3.62 ± 0.30 bn090819607 2.72E-07 ± 1.95E-08 7.26 ± 0.70 4.37 ± 0.32 1.05 ± 0.13 bn090820027 1.54E-04 ± 1.84E-07 135.43 ± 2.98 129.48 ± 1.46 124.84 ± 0.72 bn090820509 1.34E-06 ± 3.81E-08 10.21 ± 0.82 8.77 ± 0.42 5.93 ± 0.21 bn090823133 2.54E-06 ± 4.98E-08 4.96 ± 1.30 3.13 ± 0.45 2.77 ± 0.21 bn090824918 3.65E-06 ± 7.51E-08 9.78 ± 2.61 5.18 ± 0.83 3.27 ± 0.30

– 145 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090826068 8.48E-07 ± 4.09E-08 4.75 ± 0.69 3.34 ± 0.32 2.82 ± 0.16 bn090828099 2.37E-05 ± 1.86E-07 16.48 ± 1.20 15.36 ± 0.61 14.54 ± 0.30 bn090829672 7.66E-05 ± 1.58E-07 58.57 ± 1.35 52.24 ± 0.66 44.21 ± 0.32 bn090829702 4.81E-06 ± 5.60E-08 3.89 ± 0.78 3.23 ± 0.35 2.59 ± 0.15 bn090831317 9.44E-06 ± 7.31E-08 38.23 ± 1.56 21.56 ± 0.68 7.12 ± 0.26 bn090902401 1.67E-06 ± 4.29E-08 8.04 ± 1.16 6.23 ± 0.54 4.56 ± 0.26 bn090902462 2.22E-04 ± 3.17E-07 100.37 ± 1.92 88.58 ± 0.93 76.89 ± 0.44 bn090904058 2.17E-05 ± 2.21E-07 10.60 ± 1.87 8.70 ± 0.81 6.77 ± 0.41 bn090904581 1.64E-06 ± 2.83E-08 3.44 ± 1.05 2.13 ± 0.67 1.42 ± 0.24 bn090907017 4.54E-06 ± 8.71E-08 6.95 ± 1.49 3.59 ± 0.52 2.83 ± 0.23 bn090907808 1.05E-06 ± 2.35E-08 7.94 ± 0.91 6.99 ± 0.45 4.66 ± 0.21 bn090908314 3.85E-06 ± 9.40E-08 5.13 ± 1.10 3.92 ± 0.47 3.47 ± 0.23 bn090908341 2.60E-06 ± 1.59E-08 5.87 ± 0.71 3.28 ± 0.35 2.15 ± 0.16 bn090909487 5.73E-06 ± 1.97E-07 13.88 ± 4.43 7.85 ± 1.74 5.84 ± 0.80 bn090909854 1.57E-07 ± 2.23E-08 6.36 ± 1.18 3.45 ± 0.51 1.80 ± 0.22 bn090910812 1.87E-05 ± 2.12E-07 7.68 ± 1.61 7.15 ± 0.77 5.05 ± 0.35 bn090912660 1.04E-05 ± 1.73E-07 4.57 ± 0.92 2.74 ± 0.38 2.09 ± 0.17 bn090915650 2.99E-06 ± 4.43E-08 5.03 ± 1.04 3.58 ± 0.41 2.83 ± 0.20 bn090917661 1.08E-06 ± 3.80E-08 4.47 ± 1.27 3.36 ± 0.53 2.71 ± 0.25 bn090920035 3.74E-06 ± 3.78E-08 8.49 ± 3.02 5.92 ± 0.74 4.57 ± 0.33 bn090922539 1.10E-05 ± 4.98E-08 16.66 ± 1.00 16.18 ± 0.50 14.65 ± 0.24 bn090922605 4.51E-06 ± 1.03E-07 12.49 ± 3.09 10.21 ± 1.39 4.82 ± 0.64 bn090924625 5.55E-07 ± 3.00E-08 9.12 ± 0.82 5.17 ± 0.34 1.48 ± 0.15 bn090925389 8.91E-06 ± 3.13E-07 7.76 ± 1.53 5.82 ± 0.61 4.56 ± 0.25 bn090926181 1.47E-04 ± 3.41E-07 135.54 ± 2.01 106.69 ± 0.90 81.45 ± 0.37 bn090926914 1.08E-05 ± 1.49E-07 6.31 ± 1.00 5.33 ± 0.47 4.61 ± 0.22 bn090927422 3.03E-07 ± 1.83E-08 6.54 ± 1.09 5.42 ± 0.59 3.32 ± 0.24 bn090928646 1.95E-06 ± 6.99E-08 7.43 ± 2.47 5.88 ± 0.65 4.68 ± 0.30 bn090929190 8.18E-06 ± 9.54E-08 30.22 ± 1.98 25.96 ± 0.94 16.73 ± 0.41 bn091002685 3.37E-07 ± 1.49E-08 3.65 ± 0.62 3.28 ± 0.37 2.45 ± 0.17 bn091003191 2.33E-05 ± 7.77E-08 46.63 ± 2.21 41.55 ± 1.07 29.16 ± 0.50 bn091005679 1.41E-06 ± 7.18E-08 3.56 ± 0.73 3.04 ± 0.34 2.18 ± 0.14

– 146 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn091006360 1.14E-07 ± 1.65E-08 5.34 ± 1.24 4.87 ± 0.61 1.70 ± 0.21 bn091010113 9.96E-06 ± 5.87E-08 73.03 ± 1.87 66.14 ± 0.88 40.30 ± 0.39 bn091012783 2.12E-06 ± 4.40E-08 18.43 ± 1.99 13.95 ± 0.95 8.35 ± 0.40 bn091015129 1.59E-06 ± 5.54E-08 11.86 ± 4.10 9.88 ± 0.75 6.38 ± 0.59 bn091017861 4.50E-07 ± 1.37E-08 4.27 ± 1.33 3.89 ± 0.33 3.32 ± 0.26 bn091017985 2.15E-06 ± 3.28E-08 3.98 ± 1.51 3.39 ± 0.39 2.13 ± 0.22 bn091018957 1.81E-07 ± 2.85E-08 10.23 ± 2.68 6.68 ± 1.13 2.24 ± 0.42 bn091019750 9.06E-08 ± 6.16E-09 7.61 ± 0.69 2.37 ± 0.28 0.65 ± 0.13 bn091020900 8.35E-06 ± 1.50E-07 10.30 ± 1.27 7.84 ± 0.56 6.77 ± 0.27 bn091020977 1.07E-05 ± 6.11E-08 8.08 ± 0.72 7.06 ± 0.32 5.95 ± 0.15 bn091023021 5.34E-07 ± 2.23E-08 7.58 ± 1.57 5.45 ± 0.70 4.30 ± 0.31 bn091024372 8.56E-06 ± 6.01E-08 5.65 ± 1.16 5.11 ± 0.59 4.23 ± 0.33 bn091024380 2.55E-05 ± 4.80E-08 6.60 ± 1.42 4.35 ± 0.59 3.46 ± 0.26 bn091026485 5.67E-07 ± 2.44E-08 4.96 ± 0.96 3.88 ± 0.47 2.70 ± 0.21 bn091026550 1.38E-06 ± 7.20E-08 8.67 ± 2.40 5.51 ± 1.11 3.86 ± 0.49 bn091030613 4.48E-06 ± 4.24E-08 5.75 ± 0.92 4.40 ± 0.41 3.80 ± 0.20 bn091030828 2.96E-05 ± 2.02E-07 11.96 ± 0.92 10.92 ± 0.46 9.40 ± 0.22 bn091031500 1.53E-05 ± 8.65E-08 9.89 ± 0.88 8.39 ± 0.44 7.19 ± 0.22 bn091101143 7.84E-06 ± 7.88E-08 16.46 ± 1.26 13.99 ± 0.57 12.27 ± 0.28 bn091102607 1.88E-06 ± 1.07E-07 6.58 ± 0.91 3.89 ± 0.41 2.94 ± 0.20 bn091103912 5.60E-06 ± 1.09E-07 8.73 ± 0.96 7.72 ± 0.46 6.46 ± 0.22 bn091106762 1.83E-06 ± 7.75E-08 7.72 ± 1.60 4.46 ± 0.72 2.98 ± 0.33 bn091107635 9.33E-07 ± 4.04E-08 5.25 ± 1.11 4.43 ± 0.56 3.62 ± 0.25 bn091109895 2.02E-06 ± 4.19E-08 10.84 ± 1.31 9.42 ± 0.63 6.22 ± 0.29 bn091112737 9.90E-06 ± 8.86E-08 5.74 ± 0.86 5.09 ± 0.40 4.17 ± 0.19 bn091112928 4.57E-06 ± 4.55E-08 5.87 ± 0.87 3.66 ± 0.38 2.93 ± 0.17 bn091115177 1.54E-06 ± 5.85E-08 3.30 ± 0.97 2.09 ± 0.28 1.45 ± 0.17 bn091117080 3.68E-06 ± 4.23E-08 6.29 ± 1.96 3.40 ± 0.58 2.64 ± 0.32 bn091120191 2.85E-05 ± 4.09E-07 26.85 ± 1.18 25.04 ± 0.56 19.70 ± 0.26 bn091122163 1.10E-07 ± 3.41E-08 3.06 ± 1.03 2.68 ± 0.44 1.60 ± 0.22 bn091123081 2.13E-06 ± 8.84E-08 5.76 ± 1.48 4.93 ± 0.61 4.09 ± 0.33 bn091123298 6.40E-05 ± 3.68E-07 10.07 ± 1.19 8.89 ± 0.56 6.18 ± 0.25

– 147 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn091126333 3.54E-07 ± 3.56E-08 9.99 ± 0.92 7.49 ± 0.42 1.90 ± 0.16 bn091126389 3.54E-07 ± 3.56E-08 9.99 ± 0.92 7.49 ± 0.42 1.90 ± 0.16 bn091127976 2.07E-05 ± 3.70E-08 102.97 ± 2.21 97.54 ± 1.10 68.22 ± 0.47 bn091128285 4.04E-05 ± 4.45E-07 14.78 ± 1.26 11.86 ± 0.59 9.71 ± 0.27 bn091201089 9.43E-07 ± 2.09E-08 3.96 ± 0.65 2.09 ± 0.20 1.48 ± 0.11 bn091202072 1.67E-06 ± 3.31E-08 4.67 ± 0.86 3.46 ± 0.37 2.75 ± 0.18 bn091202219 6.80E-06 ± 1.51E-07 5.60 ± 0.89 3.98 ± 0.29 3.34 ± 0.18 bn091207333 5.37E-06 ± 1.15E-07 6.83 ± 0.89 4.30 ± 0.38 3.46 ± 0.18 bn091208410 6.19E-06 ± 1.90E-07 31.01 ± 1.43 27.96 ± 0.68 20.58 ± 0.32 bn091209001 1.00E-05 ± 1.92E-07 10.32 ± 2.21 7.07 ± 0.97 5.99 ± 0.44 bn091215234 9.87E-07 ± 1.23E-08 5.09 ± 1.42 4.14 ± 0.67 2.81 ± 0.30 bn091219462 8.53E-07 ± 2.59E-08 5.91 ± 1.16 5.21 ± 0.60 4.12 ± 0.27 bn091220442 5.83E-06 ± 4.50E-08 11.61 ± 1.07 9.92 ± 0.53 8.69 ± 0.25 bn091221870 8.94E-06 ± 2.21E-07 7.00 ± 0.73 5.49 ± 0.36 4.35 ± 0.16 bn091223191 2.79E-07 ± 4.18E-09 3.58 ± 0.61 3.17 ± 0.29 1.76 ± 0.14 bn091223511 8.69E-06 ± 5.50E-08 4.74 ± 0.81 3.08 ± 0.28 2.28 ± 0.15 bn091224373 3.44E-07 ± 1.39E-08 6.39 ± 0.87 3.47 ± 0.38 1.27 ± 0.15 bn091227294 6.89E-06 ± 1.10E-07 7.47 ± 0.89 5.11 ± 0.38 4.14 ± 0.19 bn091230260 1.95E-06 ± 4.24E-08 3.02 ± 0.91 1.40 ± 0.30 0.87 ± 0.14 bn091230712 2.58E-06 ± 8.68E-08 6.39 ± 1.22 3.54 ± 0.49 2.76 ± 0.23 bn091231206 9.76E-06 ± 2.10E-07 6.64 ± 0.98 4.38 ± 0.42 3.83 ± 0.19 bn091231540 7.09E-07 ± 2.75E-08 3.36 ± 1.11 2.56 ± 0.45 1.88 ± 0.23 bn100101028 1.19E-06 ± 5.51E-08 5.83 ± 1.91 3.46 ± 0.85 1.64 ± 0.30 bn100101988 1.87E-06 ± 8.05E-08 3.14 ± 0.43 2.81 ± 0.24 2.08 ± 0.12 bn100107074 1.68E-07 ± 2.13E-08 11.72 ± 1.49 3.11 ± 0.50 1.37 ± 0.23 bn100111176 1.15E-06 ± 2.17E-08 4.74 ± 0.91 4.04 ± 0.37 2.75 ± 0.16 bn100112418 1.05E-06 ± 1.10E-08 3.84 ± 1.22 3.16 ± 0.48 2.11 ± 0.22 bn100116897 3.34E-05 ± 1.63E-07 18.02 ± 0.95 16.48 ± 0.46 15.87 ± 0.23 bn100117879 4.23E-07 ± 6.93E-08 7.95 ± 0.86 5.76 ± 0.39 1.59 ± 0.13 bn100118100 1.44E-06 ± 1.08E-07 5.70 ± 0.97 4.00 ± 0.43 3.20 ± 0.17 bn100122616 1.20E-05 ± 1.61E-07 52.82 ± 1.98 47.69 ± 0.90 44.28 ± 0.44 bn100126460 1.03E-06 ± 5.76E-08 3.82 ± 0.82 3.16 ± 0.43 1.60 ± 0.17

– 148 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100130729 8.57E-06 ± 9.33E-08 7.65 ± 0.87 6.15 ± 0.40 5.49 ± 0.20 bn100130777 1.39E-05 ± 1.71E-07 5.73 ± 0.88 4.47 ± 0.42 3.49 ± 0.20 bn100131730 7.34E-06 ± 7.61E-08 36.51 ± 2.35 31.19 ± 1.09 24.34 ± 0.51 bn100201588 1.07E-05 ± 6.07E-08 4.48 ± 0.84 3.81 ± 0.40 2.98 ± 0.18 bn100204024 1.03E-05 ± 1.55E-07 5.47 ± 0.69 4.75 ± 0.34 4.11 ± 0.17 bn100204566 3.78E-06 ± 4.67E-08 5.89 ± 1.26 4.21 ± 0.64 3.09 ± 0.26 bn100204858 3.15E-07 ± 2.63E-08 3.85 ± 0.86 2.74 ± 0.33 1.27 ± 0.15 bn100205490 1.36E-06 ± 2.91E-08 5.03 ± 1.00 3.61 ± 0.36 3.11 ± 0.18 bn100206563 8.69E-07 ± 1.88E-08 25.23 ± 0.98 11.30 ± 0.40 2.62 ± 0.14 bn100207665 2.08E-06 ± 3.73E-08 4.39 ± 1.00 3.16 ± 0.45 1.88 ± 0.18 bn100207721 4.34E-07 ± 2.27E-08 3.09 ± 0.73 1.71 ± 0.33 1.06 ± 0.15 bn100208386 1.81E-07 ± 1.45E-08 3.48 ± 0.80 2.37 ± 0.60 0.62 ± 0.22 bn100210101 2.11E-06 ± 2.99E-08 4.59 ± 0.86 3.55 ± 0.39 3.23 ± 0.17 bn100211440 1.52E-05 ± 1.67E-07 14.00 ± 1.71 12.15 ± 0.83 11.16 ± 0.39 bn100212550 3.60E-06 ± 9.21E-08 4.91 ± 0.53 4.60 ± 0.32 3.67 ± 0.16 bn100212588 3.46E-07 ± 1.61E-08 4.87 ± 0.98 3.55 ± 0.45 2.98 ± 0.21 bn100216422 3.88E-07 ± 1.46E-08 9.00 ± 1.20 4.87 ± 0.47 1.29 ± 0.19 bn100218194 2.64E-06 ± 9.87E-08 3.66 ± 0.86 2.28 ± 0.34 1.41 ± 0.14 bn100219026 3.48E-06 ± 6.97E-08 6.36 ± 1.21 3.29 ± 0.48 1.92 ± 0.22 bn100221368 1.83E-06 ± 3.13E-08 3.57 ± 0.73 2.54 ± 0.34 1.77 ± 0.14 bn100223110 1.50E-06 ± 1.13E-08 18.61 ± 1.90 11.22 ± 0.58 3.09 ± 0.20 bn100224112 1.07E-05 ± 3.69E-07 13.82 ± 1.26 12.44 ± 0.58 10.87 ± 0.30 bn100225115 5.85E-06 ± 8.18E-08 5.30 ± 0.62 4.37 ± 0.29 3.82 ± 0.15 bn100225249 5.96E-07 ± 5.95E-08 7.28 ± 2.37 2.91 ± 0.65 1.48 ± 0.37 bn100225580 6.40E-06 ± 1.10E-07 14.05 ± 0.87 13.36 ± 0.43 11.62 ± 0.21 bn100225703 1.61E-06 ± 4.00E-08 4.25 ± 0.66 3.18 ± 0.28 2.69 ± 0.14 bn100228544 2.77E-06 ± 5.05E-08 5.02 ± 0.77 2.78 ± 0.36 1.69 ± 0.16 bn100228873 6.91E-07 ± 1.76E-08 4.27 ± 0.85 3.00 ± 0.37 2.46 ± 0.17 bn100301068 2.84E-07 ± 1.35E-08 9.15 ± 1.05 4.62 ± 0.46 1.71 ± 0.20 bn100301223 2.40E-06 ± 6.07E-08 5.28 ± 0.86 4.36 ± 0.40 3.41 ± 0.19 bn100304004 6.31E-06 ± 1.41E-07 8.08 ± 1.61 5.37 ± 0.72 3.65 ± 0.31 bn100304534 4.90E-06 ± 1.59E-07 7.93 ± 1.28 5.12 ± 0.62 4.08 ± 0.28

– 149 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100306199 5.68E-07 ± 2.24E-08 4.24 ± 1.21 1.76 ± 0.45 1.32 ± 0.20 bn100307928 1.54E-06 ± 2.23E-08 4.72 ± 0.86 3.60 ± 0.37 3.05 ± 0.18 bn100311518 2.57E-06 ± 9.86E-08 4.35 ± 0.84 3.36 ± 0.39 2.56 ± 0.18 bn100313288 4.40E-06 ± 7.60E-08 8.47 ± 0.95 6.70 ± 0.43 6.05 ± 0.21 bn100313509 2.54E-06 ± 3.99E-08 4.24 ± 1.24 3.16 ± 0.38 1.87 ± 0.21 bn100315361 2.58E-06 ± 4.35E-08 2.92 ± 1.02 1.69 ± 0.44 1.01 ± 0.17 bn100318611 1.90E-06 ± 1.97E-08 5.38 ± 1.03 3.42 ± 0.48 2.62 ± 0.22 bn100322045 5.71E-05 ± 2.13E-07 20.08 ± 1.65 18.98 ± 0.80 16.10 ± 0.38 bn100323542 2.04E-06 ± 1.27E-07 4.77 ± 1.01 3.87 ± 0.48 3.22 ± 0.22 bn100324172 4.28E-05 ± 1.72E-07 36.87 ± 1.30 34.25 ± 0.64 29.54 ± 0.30 bn100325246 1.33E-06 ± 1.74E-08 6.48 ± 0.99 5.24 ± 0.47 4.90 ± 0.24 bn100325275 3.35E-06 ± 4.17E-08 7.24 ± 1.19 5.86 ± 0.57 5.02 ± 0.26 bn100326294 3.82E-07 ± 5.86E-08 5.40 ± 0.96 3.80 ± 0.45 1.89 ± 0.20 bn100326402 1.18E-05 ± 2.71E-07 6.03 ± 1.03 4.48 ± 0.47 3.52 ± 0.21 bn100328141 1.01E-06 ± 2.35E-08 13.41 ± 0.76 10.09 ± 0.36 4.15 ± 0.14 bn100330309 4.30E-06 ± 5.30E-08 9.95 ± 1.35 7.86 ± 0.63 7.06 ± 0.29 bn100330856 6.20E-07 ± 1.27E-08 4.77 ± 0.73 3.17 ± 0.34 2.80 ± 0.17 bn100401297 1.90E-06 ± 2.76E-08 6.01 ± 1.11 4.89 ± 0.47 4.08 ± 0.21 bn100406758 1.12E-06 ± 3.29E-08 4.75 ± 0.70 3.66 ± 0.36 2.95 ± 0.18 bn100410356 8.29E-07 ± 3.78E-08 5.28 ± 1.57 3.70 ± 0.66 2.05 ± 0.32 bn100410740 6.21E-06 ± 3.11E-07 20.67 ± 3.88 13.23 ± 1.67 9.38 ± 0.72 bn100411516 2.14E-07 ± 2.03E-08 5.46 ± 0.94 2.59 ± 0.62 1.42 ± 0.22 bn100413732 1.05E-05 ± 8.40E-08 4.16 ± 0.91 2.87 ± 0.31 2.07 ± 0.17 bn100414097 8.85E-05 ± 1.86E-07 28.16 ± 1.05 25.61 ± 0.52 21.93 ± 0.24 bn100417166 3.31E-07 ± 4.54E-09 7.37 ± 0.87 4.09 ± 0.35 1.11 ± 0.13 bn100417789 1.36E-06 ± 4.93E-08 4.47 ± 1.01 2.18 ± 0.41 1.69 ± 0.20 bn100420008 4.31E-06 ± 3.66E-08 6.52 ± 0.68 5.49 ± 0.37 4.27 ± 0.18 bn100421917 6.69E-06 ± 2.01E-07 5.28 ± 0.99 4.20 ± 0.44 2.97 ± 0.19 bn100423244 7.92E-06 ± 1.21E-07 5.38 ± 0.76 3.99 ± 0.32 3.35 ± 0.15 bn100424729 7.41E-06 ± 5.66E-08 5.16 ± 2.00 3.93 ± 0.62 2.75 ± 0.29 bn100424876 1.49E-05 ± 1.72E-07 6.59 ± 0.81 5.22 ± 0.37 4.53 ± 0.18 bn100427356 2.28E-06 ± 6.03E-08 6.09 ± 0.89 4.77 ± 0.40 3.82 ± 0.19

– 150 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100429999 2.78E-06 ± 4.31E-08 4.22 ± 0.72 2.79 ± 0.33 2.40 ± 0.16 bn100502356 1.56E-05 ± 2.08E-07 7.35 ± 0.84 6.24 ± 0.42 5.18 ± 0.20 bn100503554 1.73E-05 ± 4.10E-07 9.34 ± 0.75 7.75 ± 0.37 5.87 ± 0.18 bn100504806 2.33E-06 ± 1.26E-07 6.46 ± 2.31 4.44 ± 0.60 3.30 ± 0.36 bn100506653 2.42E-06 ± 5.33E-08 3.85 ± 0.84 3.40 ± 0.35 2.55 ± 0.18 bn100507577 9.97E-06 ± 1.15E-07 4.75 ± 0.95 3.55 ± 0.39 3.29 ± 0.20 bn100510810 3.72E-06 ± 5.08E-08 6.70 ± 1.21 6.23 ± 0.43 4.32 ± 0.22 bn100511035 3.00E-05 ± 1.03E-07 24.87 ± 1.01 21.75 ± 0.51 14.46 ± 0.23 bn100513879 3.71E-06 ± 5.18E-08 9.68 ± 0.99 8.56 ± 0.46 7.14 ± 0.22 bn100515467 6.11E-06 ± 5.08E-08 19.34 ± 1.00 17.98 ± 0.49 16.23 ± 0.24 bn100516369 1.88E-07 ± 1.28E-08 5.09 ± 1.06 3.20 ± 0.47 1.60 ± 0.20 bn100516396 1.84E-07 ± 1.87E-08 3.54 ± 0.47 2.25 ± 0.25 1.14 ± 0.12 bn100517072 6.59E-06 ± 1.74E-08 18.68 ± 1.19 16.09 ± 0.55 13.75 ± 0.26 bn100517132 1.27E-06 ± 4.62E-08 3.83 ± 0.87 2.38 ± 0.35 1.95 ± 0.15 bn100517154 2.79E-06 ± 3.27E-08 14.45 ± 1.58 11.64 ± 0.76 9.12 ± 0.37 bn100517243 2.69E-06 ± 4.27E-08 5.59 ± 0.85 5.34 ± 0.47 4.65 ± 0.22 bn100517639 2.91E-06 ± 1.29E-07 11.22 ± 1.24 9.83 ± 0.61 7.64 ± 0.30 bn100519204 2.07E-05 ± 2.27E-07 8.81 ± 0.84 7.28 ± 0.41 6.66 ± 0.19 bn100522157 3.86E-06 ± 4.07E-08 15.02 ± 0.95 13.44 ± 0.54 11.06 ± 0.25 bn100525744 6.44E-07 ± 9.48E-08 8.74 ± 0.96 5.31 ± 0.44 2.52 ± 0.19 bn100527795 1.39E-05 ± 4.47E-08 8.61 ± 1.47 7.39 ± 0.67 6.49 ± 0.31 bn100528075 2.71E-05 ± 5.05E-08 17.32 ± 1.01 15.57 ± 0.52 14.77 ± 0.25 bn100530737 4.82E-07 ± 2.11E-08 4.75 ± 0.77 2.68 ± 0.34 2.07 ± 0.16 bn100604287 5.51E-06 ± 4.22E-08 10.20 ± 1.19 8.09 ± 0.58 7.48 ± 0.27 bn100605774 7.57E-07 ± 2.17E-08 3.56 ± 0.95 2.84 ± 0.39 1.94 ± 0.21 bn100608382 1.70E-06 ± 2.05E-08 4.35 ± 1.14 2.93 ± 0.42 2.29 ± 0.19 bn100609783 1.74E-05 ± 6.07E-07 5.06 ± 0.88 3.53 ± 0.40 3.14 ± 0.19 bn100612545 2.24E-06 ± 3.41E-08 12.32 ± 1.03 9.29 ± 0.45 5.80 ± 0.20 bn100612726 1.36E-05 ± 3.60E-07 28.42 ± 1.26 26.83 ± 0.59 26.08 ± 0.29 bn100614498 1.96E-05 ± 3.26E-07 5.93 ± 0.80 6.44 ± 0.37 5.46 ± 0.16 bn100615083 8.72E-06 ± 8.20E-08 10.12 ± 0.96 9.45 ± 0.46 8.33 ± 0.22 bn100616773 2.76E-07 ± 1.73E-08 8.43 ± 1.34 5.27 ± 0.61 2.03 ± 0.26

– 151 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100619015 1.13E-05 ± 7.39E-08 13.06 ± 1.56 9.51 ± 0.72 7.40 ± 0.30 bn100620119 3.72E-06 ± 8.43E-08 5.44 ± 1.50 3.88 ± 0.47 2.85 ± 0.20 bn100621452 7.67E-06 ± 2.90E-07 4.66 ± 0.83 3.53 ± 0.37 3.14 ± 0.18 bn100621529 1.37E-07 ± 4.52E-09 2.87 ± 0.64 1.52 ± 0.29 1.12 ± 0.14 bn100625773 1.10E-06 ± 6.40E-08 16.54 ± 1.60 15.42 ± 0.84 4.90 ± 0.31 bn100625891 1.40E-06 ± 1.46E-08 3.00 ± 1.16 2.54 ± 0.39 1.71 ± 0.20 bn100629801 1.15E-06 ± 1.05E-07 18.79 ± 1.80 16.54 ± 0.87 8.76 ± 0.40 bn100701490 2.60E-05 ± 4.26E-08 61.92 ± 1.93 35.45 ± 0.74 22.92 ± 0.31 bn100704149 1.04E-05 ± 1.12E-07 9.24 ± 0.89 7.85 ± 0.43 7.01 ± 0.20 bn100706693 1.32E-07 ± 6.86E-09 3.84 ± 0.69 2.53 ± 0.35 0.52 ± 0.17 bn100707032 8.77E-05 ± 1.56E-07 54.94 ± 1.66 52.27 ± 0.84 48.32 ± 0.42 bn100709602 8.08E-06 ± 7.53E-08 5.78 ± 1.06 4.56 ± 0.48 3.75 ± 0.24 bn100713980 3.05E-06 ± 1.70E-08 6.12 ± 1.17 5.13 ± 0.58 4.12 ± 0.26 bn100714672 3.25E-06 ± 9.59E-08 9.52 ± 2.74 8.38 ± 1.27 4.28 ± 0.57 bn100714686 1.56E-06 ± 3.63E-08 22.04 ± 2.34 17.40 ± 1.10 9.13 ± 0.45 bn100715477 2.55E-06 ± 1.36E-07 4.33 ± 0.72 3.22 ± 0.28 2.14 ± 0.12 bn100717372 4.26E-07 ± 2.68E-08 7.57 ± 1.36 5.09 ± 0.67 3.49 ± 0.28 bn100717446 3.33E-07 ± 1.44E-08 5.56 ± 1.03 3.78 ± 0.45 2.61 ± 0.21 bn100718160 2.75E-06 ± 5.24E-08 6.69 ± 1.07 5.87 ± 0.51 4.05 ± 0.22 bn100718796 2.53E-06 ± 3.98E-08 4.19 ± 1.14 3.36 ± 0.47 2.44 ± 0.23 bn100719311 3.87E-07 ± 3.66E-08 3.88 ± 0.83 2.56 ± 0.42 1.90 ± 0.20 bn100719825 2.74E-07 ± 2.49E-08 4.57 ± 1.45 3.74 ± 0.57 2.18 ± 0.26 bn100719989 5.19E-05 ± 6.54E-07 81.99 ± 2.26 76.71 ± 1.09 54.00 ± 0.49 bn100722096 8.31E-06 ± 3.92E-08 43.81 ± 2.02 37.72 ± 0.95 24.89 ± 0.44 bn100722291 1.04E-07 ± 2.50E-08 7.40 ± 2.09 4.38 ± 0.99 1.73 ± 0.44 bn100724029 2.17E-04 ± 5.68E-07 27.07 ± 1.25 25.47 ± 0.64 23.79 ± 0.32 bn100725475 4.69E-06 ± 2.30E-07 7.87 ± 2.18 4.80 ± 0.66 3.61 ± 0.31 bn100727238 1.06E-06 ± 2.23E-08 3.72 ± 1.13 2.84 ± 0.45 1.71 ± 0.23 bn100728095 1.28E-04 ± 5.76E-07 13.03 ± 1.20 12.12 ± 0.59 10.55 ± 0.28 bn100728439 3.34E-06 ± 6.47E-08 8.42 ± 1.27 7.59 ± 0.57 6.15 ± 0.27 bn100730463 6.06E-06 ± 1.49E-07 3.90 ± 0.81 2.59 ± 0.32 2.23 ± 0.15 bn100802240 1.20E-06 ± 3.23E-08 2.91 ± 0.94 2.14 ± 0.39 1.38 ± 0.17

– 152 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100804104 1.07E-05 ± 2.05E-07 19.16 ± 1.20 17.83 ± 0.58 16.60 ± 0.29 bn100805300 2.04E-07 ± 7.35E-08 21.48 ± 3.62 5.65 ± 1.21 1.70 ± 0.53 bn100805845 1.06E-05 ± 1.69E-07 7.57 ± 0.89 6.84 ± 0.40 6.13 ± 0.19 bn100810049 3.94E-07 ± 4.60E-08 4.46 ± 1.06 3.85 ± 0.48 3.08 ± 0.20 bn100811108 2.93E-06 ± 1.88E-08 19.03 ± 1.00 14.76 ± 0.47 5.86 ± 0.18 bn100811781 4.68E-06 ± 7.63E-08 7.23 ± 1.51 5.71 ± 0.68 3.91 ± 0.30 bn100814160 1.49E-05 ± 9.47E-08 6.94 ± 1.41 5.04 ± 0.56 4.60 ± 0.28 bn100814351 4.15E-06 ± 4.08E-08 13.21 ± 1.56 11.56 ± 0.77 10.38 ± 0.37 bn100816009 2.53E-05 ± 2.34E-07 12.27 ± 1.71 9.17 ± 0.68 7.42 ± 0.36 bn100816026 3.65E-06 ± 5.31E-08 19.88 ± 1.08 17.78 ± 0.52 15.59 ± 0.25 bn100819498 3.32E-06 ± 1.06E-07 5.05 ± 0.89 3.20 ± 0.38 2.49 ± 0.18 bn100820373 2.99E-06 ± 5.62E-08 19.87 ± 1.49 17.90 ± 0.76 14.65 ± 0.36 bn100825287 1.38E-06 ± 2.97E-08 14.24 ± 1.78 12.85 ± 0.80 10.13 ± 0.40 bn100826957 1.64E-04 ± 9.71E-08 37.33 ± 1.71 33.19 ± 0.81 29.58 ± 0.40 bn100827455 1.03E-06 ± 2.24E-08 19.12 ± 1.24 8.86 ± 0.51 3.14 ± 0.20 bn100829374 7.29E-06 ± 4.81E-08 8.10 ± 1.31 7.41 ± 0.46 6.43 ± 0.30 bn100829876 1.50E-05 ± 7.20E-08 82.08 ± 2.33 68.67 ± 1.08 45.05 ± 0.46 bn100831651 2.93E-06 ± 1.14E-07 5.42 ± 2.24 3.76 ± 0.80 2.60 ± 0.38 bn100902990 2.11E-06 ± 4.14E-08 5.78 ± 1.31 3.26 ± 0.46 2.70 ± 0.24 bn100905907 1.85E-06 ± 2.04E-08 4.95 ± 1.18 3.93 ± 0.63 3.15 ± 0.27 bn100906576 2.33E-05 ± 5.79E-08 19.42 ± 1.85 18.13 ± 0.88 14.49 ± 0.42 bn100907751 7.33E-07 ± 5.55E-08 4.92 ± 1.04 4.05 ± 0.57 3.41 ± 0.26 bn100910818 1.34E-05 ± 4.74E-08 33.32 ± 1.51 31.39 ± 0.73 23.22 ± 0.34 bn100911816 8.68E-07 ± 3.63E-08 5.42 ± 0.93 3.14 ± 0.40 2.50 ± 0.19 bn100915243 4.75E-07 ± 2.80E-08 5.03 ± 1.70 2.78 ± 0.73 1.84 ± 0.32 bn100916779 1.78E-06 ± 1.38E-07 21.34 ± 2.97 14.72 ± 1.33 4.97 ± 0.46 bn100918863 8.92E-05 ± 2.29E-06 10.94 ± 0.79 9.48 ± 0.37 8.72 ± 0.18 bn100919884 5.76E-06 ± 8.61E-08 5.39 ± 0.71 4.36 ± 0.23 3.97 ± 0.16 bn100922625 4.25E-07 ± 1.22E-08 2.55 ± 1.03 1.96 ± 0.43 1.47 ± 0.22 bn100923844 3.92E-06 ± 5.12E-08 8.19 ± 1.38 7.29 ± 0.63 6.61 ± 0.31 bn100924165 3.33E-06 ± 3.80E-08 9.75 ± 0.74 9.20 ± 0.38 7.32 ± 0.18 bn100926595 6.97E-06 ± 1.59E-08 11.12 ± 1.72 9.52 ± 0.82 8.44 ± 0.37

– 153 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100926694 1.37E-06 ± 3.29E-08 3.66 ± 0.98 2.42 ± 0.20 1.68 ± 0.17 bn100929235 4.95E-07 ± 1.74E-08 2.72 ± 0.70 1.86 ± 0.31 1.44 ± 0.18 bn100929315 3.25E-07 ± 1.97E-08 5.30 ± 1.66 3.59 ± 0.66 2.47 ± 0.28 bn100929916 7.61E-07 ± 2.20E-08 16.15 ± 1.77 9.20 ± 0.76 3.64 ± 0.32 bn101002279 4.40E-07 ± 3.32E-08 2.87 ± 0.93 2.16 ± 0.41 1.37 ± 0.21 bn101003244 2.23E-06 ± 3.27E-08 8.43 ± 1.32 7.57 ± 0.57 6.33 ± 0.26 bn101004426 9.03E-06 ± 1.02E-07 6.09 ± 1.86 4.08 ± 0.75 3.10 ± 0.42 bn101008697 1.35E-06 ± 4.34E-08 5.51 ± 1.29 4.31 ± 0.59 2.66 ± 0.26 bn101010190 1.55E-06 ± 6.00E-08 3.98 ± 1.02 3.01 ± 0.48 1.93 ± 0.20 bn101011707 2.71E-06 ± 9.10E-08 7.12 ± 3.00 4.95 ± 0.63 2.77 ± 0.43 bn101013412 6.41E-06 ± 7.61E-08 12.30 ± 0.98 10.79 ± 0.47 7.78 ± 0.22 bn101014175 2.01E-04 ± 4.27E-07 71.22 ± 1.79 69.29 ± 0.76 58.96 ± 0.42 bn101015558 3.74E-05 ± 2.44E-07 4.83 ± 0.75 3.60 ± 0.34 2.92 ± 0.16 bn101016243 2.44E-06 ± 1.49E-08 14.41 ± 1.29 14.04 ± 0.64 11.58 ± 0.32 bn101017619 1.78E-06 ± 1.81E-08 3.00 ± 0.80 2.49 ± 0.20 1.26 ± 0.18 bn101021009 2.23E-05 ± 5.39E-07 14.94 ± 2.47 11.84 ± 0.75 10.12 ± 0.45 bn101021063 2.93E-07 ± 2.06E-08 4.03 ± 0.97 3.11 ± 0.48 1.99 ± 0.23 bn101023951 6.37E-05 ± 5.10E-07 41.16 ± 2.11 38.48 ± 1.03 36.74 ± 0.51 bn101024486 3.33E-06 ± 1.32E-07 16.86 ± 4.56 12.28 ± 1.95 8.27 ± 0.79 bn101025146 2.79E-07 ± 1.56E-08 2.46 ± 0.88 1.82 ± 0.37 1.24 ± 0.20 bn101026034 9.30E-07 ± 2.26E-08 13.99 ± 1.75 10.19 ± 0.58 2.85 ± 0.26 bn101027230 1.44E-07 ± 8.75E-09 5.49 ± 1.13 2.77 ± 0.40 0.61 ± 0.20 bn101030664 5.12E-06 ± 3.86E-08 5.47 ± 1.42 2.89 ± 0.56 2.01 ± 0.24 bn101031625 2.22E-07 ± 2.91E-08 9.82 ± 1.47 7.57 ± 0.67 2.69 ± 0.26 bn101101744 6.50E-07 ± 2.28E-08 9.94 ± 1.43 9.57 ± 0.72 7.87 ± 0.30 bn101101899 2.60E-06 ± 2.72E-08 4.48 ± 1.29 2.82 ± 0.52 2.07 ± 0.26 bn101102840 1.72E-06 ± 3.28E-08 4.68 ± 1.05 2.51 ± 0.44 1.64 ± 0.20 bn101104810 8.93E-07 ± 2.54E-08 5.16 ± 0.98 4.02 ± 0.37 3.01 ± 0.21 bn101107011 7.26E-06 ± 2.42E-07 5.46 ± 1.42 4.12 ± 0.29 3.50 ± 0.23 bn101112924 2.26E-06 ± 7.71E-08 9.82 ± 1.73 9.01 ± 0.87 7.89 ± 0.40 bn101112984 8.57E-06 ± 9.74E-08 4.76 ± 1.25 4.12 ± 0.40 2.02 ± 0.22 bn101113483 3.06E-06 ± 2.93E-08 10.58 ± 13.08 6.27 ± 0.83 5.39 ± 0.44

– 154 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn101116481 3.04E-07 ± 6.39E-08 5.76 ± 1.28 4.26 ± 0.72 1.96 ± 0.30 bn101117496 8.24E-06 ± 7.69E-08 5.23 ± 1.24 4.13 ± 0.58 3.17 ± 0.26 bn101119685 1.69E-07 ± 1.59E-08 4.34 ± 1.69 3.71 ± 0.61 2.15 ± 0.28 bn101123952 1.13E-04 ± 8.62E-08 50.27 ± 2.43 46.43 ± 1.21 40.25 ± 0.58 bn101126198 3.10E-05 ± 1.45E-07 24.59 ± 1.12 22.46 ± 0.52 21.58 ± 0.25 bn101127093 6.96E-07 ± 1.73E-08 3.12 ± 1.02 1.87 ± 0.41 1.26 ± 0.22 bn101127102 3.09E-06 ± 2.83E-08 3.67 ± 1.05 2.71 ± 0.49 1.98 ± 0.21 bn101128322 8.36E-07 ± 1.52E-08 3.99 ± 1.18 2.86 ± 0.42 2.17 ± 0.21 bn101129652 8.63E-07 ± 4.43E-08 10.61 ± 1.36 8.66 ± 0.56 3.47 ± 0.23 bn101129726 8.08E-07 ± 2.61E-08 14.12 ± 1.31 10.54 ± 0.60 5.15 ± 0.26 bn101130074 2.34E-07 ± 5.06E-08 3.37 ± 1.37 1.84 ± 0.54 1.04 ± 0.27 bn101201418 2.37E-05 ± 9.90E-08 8.72 ± 1.34 7.85 ± 0.58 6.95 ± 0.31 bn101202154 1.41E-06 ± 7.96E-08 11.13 ± 2.96 6.76 ± 1.38 4.06 ± 0.66 bn101204343 2.82E-07 ± 1.49E-08 6.57 ± 0.95 3.67 ± 0.37 0.85 ± 0.18 bn101205309 3.90E-07 ± 3.80E-08 3.27 ± 1.09 2.12 ± 0.45 1.35 ± 0.23 bn101206036 5.84E-06 ± 8.19E-08 5.12 ± 0.87 4.80 ± 0.46 4.14 ± 0.22 bn101207536 6.65E-06 ± 7.18E-08 7.79 ± 1.18 6.50 ± 0.56 3.62 ± 0.22 bn101208203 3.10E-07 ± 1.59E-08 4.62 ± 1.00 4.12 ± 0.46 1.59 ± 0.24 bn101208498 3.84E-06 ± 5.31E-08 48.87 ± 2.38 47.54 ± 1.18 31.96 ± 0.55 bn101211485 1.63E-06 ± 4.53E-08 5.45 ± 1.14 3.98 ± 0.45 3.48 ± 0.23 bn101213451 7.40E-06 ± 1.05E-07 7.82 ± 2.04 7.05 ± 0.66 4.53 ± 0.40 bn101213849 1.35E-06 ± 2.04E-08 8.64 ± 1.16 6.94 ± 0.57 5.77 ± 0.28 bn101214748 2.37E-07 ± 3.01E-08 7.41 ± 1.38 5.72 ± 0.47 1.92 ± 0.26 bn101214993 1.09E-06 ± 3.76E-08 3.70 ± 1.15 3.55 ± 0.37 2.87 ± 0.23 bn101216721 3.04E-06 ± 6.78E-08 25.08 ± 1.84 24.07 ± 0.88 18.75 ± 0.42 bn101219686 3.99E-06 ± 4.89E-08 3.16 ± 0.84 2.60 ± 0.35 2.00 ± 0.18 bn101220576 9.60E-06 ± 9.41E-08 7.32 ± 1.80 5.01 ± 0.78 3.46 ± 0.34 bn101220864 5.29E-06 ± 9.03E-08 7.69 ± 0.87 6.56 ± 0.39 6.06 ± 0.20 bn101223834 2.46E-06 ± 4.54E-08 3.82 ± 1.20 2.98 ± 0.74 1.73 ± 0.29 bn101224227 1.91E-07 ± 2.69E-08 6.71 ± 1.04 4.83 ± 0.59 1.31 ± 0.21 bn101224578 3.89E-06 ± 2.23E-08 6.75 ± 0.99 6.53 ± 0.34 5.33 ± 0.20 bn101224614 2.61E-06 ± 5.76E-08 6.35 ± 1.41 4.54 ± 0.51 3.11 ± 0.25

– 155 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn101224998 1.36E-06 ± 2.60E-08 3.85 ± 0.98 3.37 ± 0.53 2.30 ± 0.23 bn101225377 2.02E-05 ± 2.96E-07 10.64 ± 1.42 7.97 ± 0.66 7.44 ± 0.33 bn101227195 3.43E-06 ± 9.02E-08 7.69 ± 1.88 5.76 ± 0.74 4.16 ± 0.39 bn101227406 1.38E-05 ± 9.30E-08 8.71 ± 1.40 7.65 ± 0.69 7.03 ± 0.34 bn101227536 6.44E-06 ± 3.68E-08 9.70 ± 1.01 8.10 ± 0.51 4.93 ± 0.22 bn101231067 1.68E-05 ± 1.18E-07 22.39 ± 1.87 19.38 ± 0.86 15.02 ± 0.40 bn110101202 2.50E-07 ± 2.82E-08 3.95 ± 1.03 3.23 ± 0.53 1.84 ± 0.24 bn110101506 6.63E-06 ± 7.23E-08 4.05 ± 1.09 2.73 ± 0.63 1.95 ± 0.23 bn110102788 3.72E-05 ± 2.05E-07 19.00 ± 1.44 17.63 ± 0.72 14.07 ± 0.35 bn110105877 2.09E-05 ± 1.05E-07 10.20 ± 1.39 9.36 ± 0.68 7.64 ± 0.32 bn110106893 4.11E-06 ± 5.62E-08 4.75 ± 1.22 3.24 ± 0.56 2.77 ± 0.27 bn110107886 1.32E-05 ± 1.24E-07 5.07 ± 0.99 4.10 ± 0.48 3.00 ± 0.21 bn110108977 2.51E-06 ± 5.58E-08 4.30 ± 1.45 2.93 ± 0.70 1.89 ± 0.31 bn110112934 4.05E-07 ± 2.72E-08 8.22 ± 1.23 6.05 ± 0.60 2.29 ± 0.23 bn110117364 2.56E-06 ± 1.07E-07 6.21 ± 2.04 2.40 ± 0.69 1.42 ± 0.32 bn110117626 3.03E-06 ± 1.91E-08 4.49 ± 1.18 3.60 ± 0.47 2.41 ± 0.23 bn110118857 2.97E-06 ± 4.35E-08 11.25 ± 1.48 10.64 ± 0.73 8.41 ± 0.34 bn110119931 1.01E-05 ± 4.56E-08 6.34 ± 1.28 5.25 ± 0.59 3.93 ± 0.28 bn110120666 1.79E-05 ± 2.31E-07 14.85 ± 1.33 11.56 ± 0.62 10.43 ± 0.30 bn110123804 1.90E-05 ± 5.99E-08 11.15 ± 1.21 9.29 ± 0.54 8.46 ± 0.26 bn110124784 1.59E-07 ± 1.36E-08 3.79 ± 1.23 1.59 ± 0.44 1.03 ± 0.20 bn110125894 8.63E-07 ± 3.67E-08 7.01 ± 1.30 6.09 ± 0.45 5.25 ± 0.27 bn110128073 1.42E-06 ± 1.04E-07 2.83 ± 1.05 2.31 ± 0.40 1.55 ± 0.19 bn110130230 2.90E-06 ± 4.24E-08 4.14 ± 1.14 3.03 ± 0.46 1.93 ± 0.22 bn110131780 5.75E-08 ± 1.52E-08 4.39 ± 1.26 3.07 ± 0.51 1.13 ± 0.23 bn110201399 3.15E-06 ± 1.65E-07 6.56 ± 1.85 4.35 ± 0.92 3.47 ± 0.44 bn110204179 3.10E-06 ± 6.58E-08 5.28 ± 1.42 4.13 ± 0.57 3.55 ± 0.27 bn110205027 1.95E-07 ± 3.61E-08 4.15 ± 1.43 2.76 ± 0.68 1.31 ± 0.31 bn110205588 4.21E-06 ± 8.33E-08 8.57 ± 3.91 5.37 ± 1.07 3.71 ± 0.48 bn110206202 7.90E-07 ± 3.97E-08 5.15 ± 1.60 3.51 ± 0.63 2.16 ± 0.29 bn110207470 2.49E-06 ± 3.75E-08 8.77 ± 1.19 5.15 ± 0.52 2.05 ± 0.21 bn110207959 3.42E-07 ± 5.48E-08 4.71 ± 1.54 3.30 ± 0.58 2.31 ± 0.28

– 156 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110209165 6.73E-07 ± 3.02E-08 3.96 ± 1.39 3.19 ± 0.63 2.18 ± 0.27 bn110212550 6.35E-07 ± 1.23E-08 17.34 ± 1.15 9.13 ± 0.47 2.50 ± 0.19 bn110213220 9.37E-06 ± 5.16E-08 21.63 ± 2.32 19.63 ± 1.12 17.76 ± 0.54 bn110213876 3.27E-08 ± 1.53E-08 4.61 ± 0.87 2.75 ± 0.66 0.86 ± 0.23 bn110217591 1.42E-06 ± 4.50E-08 3.23 ± 1.24 3.23 ± 0.31 1.15 ± 0.18 bn110220761 2.11E-06 ± 2.62E-08 4.74 ± 1.02 4.04 ± 0.52 3.46 ± 0.22 bn110221244 2.25E-06 ± 3.36E-08 5.65 ± 1.24 4.26 ± 0.54 4.02 ± 0.25 bn110226989 1.90E-06 ± 2.50E-08 4.05 ± 1.19 3.52 ± 0.38 2.46 ± 0.21 bn110227009 1.64E-07 ± 1.01E-08 3.69 ± 0.94 2.85 ± 0.46 1.78 ± 0.22 bn110227229 2.40E-06 ± 3.17E-08 6.42 ± 1.30 5.29 ± 0.61 4.50 ± 0.31 bn110227420 2.42E-06 ± 8.41E-08 5.42 ± 1.13 3.85 ± 0.57 3.50 ± 0.27 bn110228011 5.14E-06 ± 4.99E-08 8.31 ± 1.81 7.12 ± 0.69 5.60 ± 0.33 bn110228792 9.60E-07 ± 2.38E-08 3.72 ± 1.21 2.08 ± 0.49 1.25 ± 0.21 bn110301214 3.59E-05 ± 3.07E-08 130.23 ± 3.85 119.83 ± 1.87 100.73 ± 0.88 bn110302043 3.73E-06 ± 6.04E-08 8.32 ± 1.42 7.08 ± 0.59 6.29 ± 0.29 bn110304071 3.46E-06 ± 8.33E-08 6.73 ± 1.39 6.06 ± 0.70 5.43 ± 0.35 bn110307972 5.75E-07 ± 4.34E-08 5.88 ± 0.98 4.05 ± 0.41 2.32 ± 0.19 bn110311812 1.12E-06 ± 3.22E-08 5.53 ± 1.23 3.91 ± 0.48 3.46 ± 0.26 bn110316139 1.15E-07 ± 3.32E-08 5.16 ± 1.27 3.65 ± 0.49 1.33 ± 0.21 bn110318552 8.15E-06 ± 7.84E-08 13.86 ± 1.17 11.97 ± 0.57 11.02 ± 0.29 bn110319628 1.56E-06 ± 3.05E-08 4.00 ± 1.30 3.03 ± 0.55 2.67 ± 0.24 bn110319815 2.49E-06 ± 8.53E-08 8.12 ± 2.41 5.17 ± 1.01 3.54 ± 0.46 bn110321346 1.12E-06 ± 4.40E-08 2.50 ± 0.82 1.96 ± 0.27 1.47 ± 0.16 bn110322558 3.56E-06 ± 3.47E-08 4.62 ± 0.98 3.41 ± 0.48 2.60 ± 0.22 bn110328520 1.90E-05 ± 8.51E-08 7.51 ± 1.33 6.35 ± 0.51 5.73 ± 0.26 bn110331604 2.64E-07 ± 2.79E-08 4.01 ± 1.30 2.87 ± 0.52 2.20 ± 0.25 bn110401920 1.57E-06 ± 6.43E-08 10.81 ± 1.37 7.41 ± 0.64 3.53 ± 0.25 bn110402009 1.08E-05 ± 1.63E-07 27.83 ± 2.37 15.24 ± 1.05 7.81 ± 0.47 bn110407998 2.64E-05 ± 7.16E-08 22.20 ± 1.25 20.83 ± 0.63 18.13 ± 0.31 bn110409179 3.28E-07 ± 1.06E-08 9.65 ± 0.96 5.46 ± 0.45 1.20 ± 0.19 bn110410133 6.41E-06 ± 1.84E-08 4.71 ± 1.03 4.20 ± 0.34 3.08 ± 0.22 bn110410772 9.52E-07 ± 3.03E-08 5.43 ± 1.17 4.56 ± 0.40 3.23 ± 0.21

– 157 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110411629 3.58E-06 ± 6.88E-08 7.82 ± 2.85 6.15 ± 0.96 4.80 ± 0.43 bn110412315 2.55E-06 ± 2.99E-08 4.44 ± 0.82 3.70 ± 0.46 2.75 ± 0.22 bn110413938 1.10E-06 ± 3.16E-08 3.26 ± 1.23 2.35 ± 0.34 1.14 ± 0.22 bn110415541 4.72E-06 ± 5.51E-08 7.15 ± 1.71 5.42 ± 0.71 4.88 ± 0.33 bn110420946 2.44E-07 ± 2.73E-08 12.01 ± 1.78 4.86 ± 0.68 1.29 ± 0.30 bn110421757 1.06E-05 ± 7.77E-08 8.77 ± 1.19 7.95 ± 0.58 7.22 ± 0.29 bn110422029 8.06E-08 ± 1.92E-08 6.81 ± 1.09 3.53 ± 0.48 1.44 ± 0.19 bn110424758 4.65E-08 ± 9.32E-09 4.84 ± 1.01 2.09 ± 0.36 0.44 ± 0.15 bn110426629 3.31E-05 ± 1.15E-07 8.61 ± 1.74 7.41 ± 0.66 5.85 ± 0.28 bn110428338 1.58E-05 ± 6.66E-08 13.67 ± 1.59 11.04 ± 0.71 9.95 ± 0.35 bn110428388 2.16E-05 ± 1.54E-07 32.23 ± 1.54 29.27 ± 0.71 26.76 ± 0.35 bn110430375 7.07E-06 ± 3.85E-08 7.76 ± 1.30 6.84 ± 0.60 6.01 ± 0.28 bn110503145 1.87E-06 ± 3.68E-08 6.96 ± 1.31 6.21 ± 0.61 5.41 ± 0.27 bn110505203 2.03E-06 ± 6.94E-08 14.62 ± 1.67 11.78 ± 0.74 10.16 ± 0.35 bn110509142 3.76E-06 ± 4.31E-08 5.75 ± 1.45 3.60 ± 0.57 2.44 ± 0.31 bn110509475 5.26E-07 ± 1.46E-08 9.94 ± 0.99 7.21 ± 0.41 3.54 ± 0.19 bn110511616 4.89E-07 ± 4.25E-08 4.57 ± 1.13 2.87 ± 0.39 2.27 ± 0.22 bn110517453 9.89E-08 ± 2.34E-08 5.78 ± 1.04 3.35 ± 0.47 1.09 ± 0.20 bn110517573 8.74E-06 ± 3.80E-08 12.12 ± 1.41 10.71 ± 0.72 8.20 ± 0.34 bn110517902 8.74E-06 ± 3.80E-08 12.12 ± 1.41 10.71 ± 0.72 8.20 ± 0.34 bn110520302 1.04E-06 ± 5.11E-08 5.70 ± 1.98 3.44 ± 0.69 2.88 ± 0.35 bn110521478 3.61E-06 ± 8.07E-08 20.00 ± 2.63 18.30 ± 1.31 15.74 ± 0.63 bn110522256 2.11E-06 ± 3.16E-08 4.24 ± 1.20 3.33 ± 0.47 1.91 ± 0.20 bn110522296 1.06E-06 ± 4.06E-08 3.01 ± 0.79 2.04 ± 0.38 1.70 ± 0.18 bn110522633 3.04E-06 ± 2.48E-08 5.30 ± 1.18 4.71 ± 0.47 4.16 ± 0.22 bn110523344 2.23E-06 ± 4.55E-08 5.98 ± 1.42 5.29 ± 0.64 4.68 ± 0.29 bn110526715 8.46E-07 ± 2.96E-08 11.68 ± 1.50 9.62 ± 0.52 4.78 ± 0.28 bn110528624 4.60E-06 ± 5.73E-08 4.63 ± 1.24 2.87 ± 0.38 2.31 ± 0.23 bn110529034 1.47E-06 ± 1.33E-08 39.82 ± 1.64 22.94 ± 0.68 7.66 ± 0.24 bn110529262 6.78E-06 ± 4.31E-08 18.51 ± 1.65 16.50 ± 0.79 11.72 ± 0.38 bn110529811 3.33E-06 ± 2.98E-08 3.66 ± 0.85 2.98 ± 0.36 2.28 ± 0.19 bn110531448 2.29E-06 ± 2.52E-08 3.79 ± 1.05 2.96 ± 0.30 2.30 ± 0.18

– 158 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110601681 1.24E-05 ± 1.30E-07 4.77 ± 0.88 3.76 ± 0.37 3.25 ± 0.20 bn110605183 1.93E-05 ± 5.59E-08 10.04 ± 1.51 9.16 ± 0.76 8.22 ± 0.37 bn110605780 4.39E-07 ± 2.12E-08 5.04 ± 0.99 3.58 ± 0.51 3.09 ± 0.27 bn110609185 5.05E-07 ± 3.45E-08 3.52 ± 1.08 3.05 ± 0.36 2.14 ± 0.21 bn110609425 2.35E-06 ± 4.23E-08 4.72 ± 1.09 3.66 ± 0.43 2.72 ± 0.23 bn110610640 8.02E-06 ± 6.15E-08 7.87 ± 1.10 6.78 ± 0.54 5.82 ± 0.26 bn110613631 3.26E-06 ± 3.73E-08 4.41 ± 1.37 2.63 ± 0.49 1.96 ± 0.24 bn110616648 1.29E-06 ± 5.09E-08 6.52 ± 1.79 5.06 ± 0.83 3.35 ± 0.35 bn110618366 6.24E-05 ± 1.70E-07 15.26 ± 3.62 13.20 ± 0.81 9.61 ± 0.60 bn110618760 9.78E-06 ± 5.44E-08 5.77 ± 1.42 4.82 ± 0.53 3.57 ± 0.27 bn110622158 5.43E-05 ± 1.54E-07 19.68 ± 1.69 18.25 ± 0.79 17.51 ± 0.39 bn110624906 2.78E-07 ± 3.09E-08 3.45 ± 1.08 2.69 ± 0.54 1.97 ± 0.24 bn110625579 3.52E-06 ± 3.71E-08 4.48 ± 1.11 3.41 ± 0.44 2.77 ± 0.24 bn110625881 6.55E-05 ± 1.01E-07 84.28 ± 2.79 81.82 ± 1.38 76.97 ± 0.67 bn110626448 1.16E-06 ± 2.92E-08 7.18 ± 1.35 5.84 ± 0.58 5.26 ± 0.29 bn110629174 2.43E-06 ± 2.37E-08 9.01 ± 1.00 7.87 ± 0.52 5.03 ± 0.24 bn110702187 7.99E-06 ± 1.33E-07 8.77 ± 1.77 6.26 ± 0.79 5.60 ± 0.35 bn110703557 9.74E-07 ± 2.23E-08 8.30 ± 1.27 7.38 ± 0.59 5.75 ± 0.28 bn110705151 2.85E-06 ± 2.51E-08 40.70 ± 1.69 28.72 ± 0.75 7.98 ± 0.28 bn110705364 8.94E-06 ± 9.97E-08 7.62 ± 1.05 7.09 ± 0.53 6.25 ± 0.25 bn110706202 3.27E-06 ± 9.71E-08 4.01 ± 1.11 3.44 ± 0.32 2.60 ± 0.18 bn110706477 6.72E-06 ± 7.07E-08 4.43 ± 1.11 3.80 ± 0.47 3.31 ± 0.22 bn110706728 2.34E-06 ± 7.37E-08 8.89 ± 1.40 6.23 ± 0.64 4.59 ± 0.27 bn110706977 6.55E-06 ± 4.47E-08 12.88 ± 1.83 11.47 ± 0.78 9.82 ± 0.30 bn110709463 6.91E-06 ± 4.08E-08 18.94 ± 1.70 17.89 ± 0.86 15.70 ± 0.41 bn110709642 3.69E-05 ± 6.19E-08 15.14 ± 2.01 12.71 ± 0.89 11.13 ± 0.48 bn110709862 7.97E-07 ± 2.38E-08 5.87 ± 1.48 4.85 ± 0.49 3.77 ± 0.29 bn110710954 9.32E-06 ± 4.19E-08 17.63 ± 1.53 16.22 ± 0.78 12.25 ± 0.41 bn110716018 1.35E-06 ± 3.44E-08 15.17 ± 1.54 13.45 ± 0.79 7.03 ± 0.32 bn110717180 2.51E-07 ± 1.18E-08 18.53 ± 1.84 5.98 ± 0.62 1.52 ± 0.23 bn110717319 4.25E-05 ± 5.20E-08 17.41 ± 1.61 17.13 ± 0.81 16.00 ± 0.39 bn110720177 5.63E-06 ± 2.80E-08 7.39 ± 1.34 6.33 ± 0.56 5.51 ± 0.27

– 159 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110721200 3.70E-05 ± 3.85E-08 34.32 ± 1.55 32.24 ± 0.77 30.96 ± 0.38 bn110722694 2.11E-05 ± 1.15E-07 7.78 ± 1.32 6.14 ± 0.63 5.31 ± 0.29 bn110722710 1.80E-06 ± 6.68E-08 5.52 ± 1.61 4.16 ± 0.67 3.64 ± 0.29 bn110725236 1.31E-06 ± 2.93E-08 5.56 ± 1.10 4.95 ± 0.53 4.10 ± 0.25 bn110726211 4.36E-06 ± 9.67E-08 6.03 ± 1.44 5.63 ± 0.56 4.42 ± 0.29 bn110728056 3.27E-07 ± 6.30E-08 4.76 ± 0.98 3.19 ± 0.42 2.02 ± 0.20 bn110729142 4.64E-05 ± 4.78E-08 9.69 ± 1.28 7.95 ± 0.62 7.32 ± 0.30 bn110730008 1.26E-06 ± 3.69E-08 3.67 ± 1.41 2.82 ± 0.34 1.79 ± 0.21 bn110730660 7.97E-06 ± 9.20E-08 8.90 ± 1.50 7.73 ± 0.75 7.13 ± 0.38 bn110731465 2.29E-05 ± 5.70E-08 29.11 ± 2.11 26.69 ± 0.99 20.87 ± 0.46 bn110801335 3.54E-07 ± 5.40E-08 14.74 ± 3.11 10.83 ± 1.39 4.96 ± 0.57 bn110803783 2.95E-06 ± 5.05E-08 4.76 ± 1.02 3.05 ± 0.58 2.16 ± 0.18 bn110806934 7.19E-06 ± 2.82E-08 7.89 ± 1.11 6.80 ± 0.56 6.38 ± 0.27 bn110809461 3.91E-06 ± 9.55E-08 8.84 ± 1.51 7.70 ± 0.74 5.85 ± 0.34 bn110812899 1.17E-06 ± 2.18E-08 5.28 ± 1.22 5.14 ± 0.45 4.14 ± 0.25 bn110813237 4.77E-06 ± 3.69E-08 12.09 ± 1.57 10.89 ± 0.74 9.54 ± 0.33 bn110817191 1.19E-05 ± 4.49E-08 27.99 ± 1.69 26.15 ± 0.83 24.13 ± 0.40 bn110818860 5.15E-06 ± 3.31E-08 4.88 ± 1.50 3.88 ± 0.54 2.79 ± 0.27 bn110819665 3.04E-06 ± 8.23E-08 18.56 ± 3.79 15.93 ± 1.74 13.44 ± 0.81 bn110820476 7.98E-07 ± 4.37E-08 4.12 ± 1.10 3.52 ± 0.50 3.24 ± 0.25 bn110824009 1.48E-05 ± 1.54E-07 27.92 ± 1.27 24.46 ± 0.69 15.62 ± 0.28 bn110825102 4.61E-05 ± 1.11E-07 78.84 ± 1.88 65.67 ± 0.92 53.70 ± 0.44 bn110825265 2.18E-06 ± 4.63E-08 2.97 ± 0.99 2.18 ± 0.44 1.90 ± 0.20 bn110828575 2.72E-06 ± 3.70E-08 3.78 ± 1.31 2.99 ± 0.45 2.14 ± 0.23 bn110831282 4.42E-06 ± 3.12E-08 6.22 ± 1.23 5.09 ± 0.57 4.39 ± 0.26 bn110901230 1.51E-06 ± 5.75E-08 4.44 ± 1.37 3.59 ± 0.32 2.56 ± 0.25 bn110903009 1.52E-05 ± 5.22E-08 55.54 ± 3.71 52.85 ± 1.82 48.30 ± 0.89 bn110903111 3.47E-05 ± 7.61E-08 7.08 ± 0.89 5.97 ± 0.50 5.03 ± 0.23 bn110904124 1.11E-05 ± 6.85E-08 9.77 ± 1.37 9.28 ± 0.64 7.84 ± 0.34 bn110904163 3.46E-06 ± 2.68E-08 5.85 ± 0.92 4.53 ± 0.52 3.98 ± 0.24 bn110904531 3.81E-06 ± 4.95E-08 9.08 ± 1.62 9.08 ± 0.40 7.27 ± 0.18 bn110906302 3.80E-06 ± 3.14E-08 7.80 ± 1.37 5.90 ± 0.67 5.43 ± 0.32

– 160 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110909116 4.92E-05 ± 1.44E-05 3054.10 ± 4475.63 765.01 ± 1118.91 200.58 ± 279.73 bn110911071 5.94E-07 ± 8.35E-08 6.69 ± 3.06 3.75 ± 0.91 2.38 ± 0.41 bn110916016 4.23E-07 ± 6.49E-08 3.94 ± 0.95 2.79 ± 0.47 1.96 ± 0.22 bn110919634 2.68E-05 ± 1.81E-07 14.38 ± 1.53 13.07 ± 0.79 12.27 ± 0.38 bn110920338 2.69E-06 ± 2.05E-08 5.85 ± 1.30 5.33 ± 0.54 4.20 ± 0.27 bn110920546 1.72E-04 ± 2.41E-07 16.96 ± 1.37 14.95 ± 0.71 13.74 ± 0.35 bn110921444 5.90E-06 ± 1.19E-07 3.76 ± 0.86 2.73 ± 0.35 2.08 ± 0.18 bn110921577 3.36E-06 ± 5.59E-08 4.62 ± 1.12 3.09 ± 0.61 2.72 ± 0.27 bn110921912 3.63E-05 ± 7.90E-08 41.36 ± 2.43 37.69 ± 1.18 32.35 ± 0.57 bn110923835 4.09E-06 ± 7.85E-08 5.53 ± 0.94 4.37 ± 0.49 3.76 ± 0.25 bn110926107 1.20E-05 ± 7.09E-08 9.48 ± 1.50 7.02 ± 0.70 6.18 ± 0.33 bn110928180 1.42E-05 ± 9.36E-08 6.50 ± 0.89 5.15 ± 0.41 4.20 ± 0.19 bn110929187 2.20E-06 ± 1.97E-08 7.18 ± 0.98 6.02 ± 0.58 5.56 ± 0.28 bn110930564 6.23E-06 ± 1.30E-07 6.52 ± 2.28 4.63 ± 0.79 2.62 ± 0.34 bn111001804 1.90E-07 ± 1.24E-08 4.18 ± 0.70 2.74 ± 0.35 0.76 ± 0.15 bn111003465 2.10E-05 ± 5.99E-08 21.23 ± 1.33 20.50 ± 0.66 18.44 ± 0.32 bn111005398 2.05E-06 ± 3.06E-08 3.48 ± 0.98 2.74 ± 0.42 1.91 ± 0.18 bn111008992 3.03E-06 ± 2.66E-08 3.81 ± 1.27 3.44 ± 0.38 1.84 ± 0.21 bn111009282 1.20E-05 ± 5.13E-08 19.70 ± 1.71 17.91 ± 0.84 16.86 ± 0.40 bn111010237 1.10E-05 ± 1.57E-07 5.03 ± 1.32 3.63 ± 0.64 2.33 ± 0.28 bn111010660 8.71E-07 ± 3.34E-08 6.41 ± 1.31 4.56 ± 0.71 3.80 ± 0.32 bn111010709 1.26E-05 ± 5.25E-08 6.52 ± 1.22 6.08 ± 0.32 5.11 ± 0.20 bn111010899 9.59E-07 ± 5.17E-08 3.79 ± 1.13 3.17 ± 0.52 2.13 ± 0.22 bn111011094 4.20E-07 ± 1.98E-08 14.89 ± 1.17 8.88 ± 0.54 2.61 ± 0.19 bn111012456 1.65E-05 ± 8.26E-08 16.68 ± 2.19 15.01 ± 1.07 13.03 ± 0.51 bn111012811 3.29E-06 ± 3.23E-08 23.45 ± 1.47 21.56 ± 0.68 14.82 ± 0.31 bn111015427 2.42E-05 ± 3.99E-07 11.33 ± 1.91 10.07 ± 0.94 9.15 ± 0.46 bn111017657 2.07E-05 ± 5.64E-08 19.59 ± 1.27 17.95 ± 0.60 16.90 ± 0.30 bn111018595 1.11E-06 ± 5.33E-08 5.23 ± 1.27 3.98 ± 0.55 3.05 ± 0.26 bn111018785 1.76E-06 ± 3.37E-08 4.14 ± 1.19 2.15 ± 0.46 1.44 ± 0.22 bn111022854 1.26E-07 ± 1.21E-08 6.11 ± 1.04 3.88 ± 0.49 1.09 ± 0.20 bn111024722 1.58E-05 ± 1.41E-07 13.53 ± 1.54 12.46 ± 0.73 9.47 ± 0.34

– 161 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn111024896 2.32E-07 ± 1.52E-08 6.15 ± 1.17 4.51 ± 0.53 1.79 ± 0.23 bn111025078 2.98E-06 ± 3.13E-08 4.79 ± 1.39 2.52 ± 0.47 1.82 ± 0.24 bn111103441 2.98E-06 ± 7.85E-08 7.48 ± 1.31 6.47 ± 0.65 5.41 ± 0.30 bn111103948 2.82E-07 ± 5.32E-08 8.99 ± 1.45 6.50 ± 0.61 2.42 ± 0.23 bn111105457 1.68E-06 ± 4.36E-08 3.94 ± 0.97 3.55 ± 0.33 2.16 ± 0.19 bn111107035 9.07E-07 ± 3.48E-08 4.84 ± 1.88 3.85 ± 0.38 2.28 ± 0.35 bn111107076 1.04E-05 ± 5.91E-08 4.66 ± 0.98 3.52 ± 0.45 3.03 ± 0.21 bn111109453 3.05E-07 ± 3.23E-08 4.03 ± 1.40 2.74 ± 0.43 1.95 ± 0.23 bn111109873 6.69E-06 ± 5.40E-07 27.94 ± 11.41 15.59 ± 3.42 11.56 ± 1.55 bn111112908 7.67E-07 ± 2.08E-08 16.04 ± 0.99 9.91 ± 0.51 3.02 ± 0.20 bn111113410 3.10E-06 ± 6.95E-08 9.12 ± 1.36 8.16 ± 0.58 7.10 ± 0.29 bn111114233 1.11E-06 ± 2.60E-08 3.80 ± 1.10 3.42 ± 0.28 2.51 ± 0.17 bn111117510 8.26E-07 ± 2.31E-08 10.89 ± 1.06 7.43 ± 0.36 3.52 ± 0.19 bn111117526 1.42E-06 ± 2.49E-08 3.37 ± 0.89 2.09 ± 0.36 1.49 ± 0.19 bn111120556 6.73E-06 ± 8.42E-08 6.09 ± 1.39 5.95 ± 0.49 4.86 ± 0.25 bn111124308 6.26E-07 ± 2.19E-08 3.19 ± 0.90 1.94 ± 0.41 1.54 ± 0.18 bn111127810 8.64E-06 ± 5.18E-08 22.83 ± 2.09 21.49 ± 1.03 18.83 ± 0.49 bn111201599 1.86E-06 ± 6.92E-08 3.32 ± 0.94 2.56 ± 0.39 1.42 ± 0.18 bn111203054 4.65E-06 ± 4.62E-08 9.05 ± 1.24 7.49 ± 0.60 6.37 ± 0.29 bn111203609 6.95E-07 ± 4.39E-08 3.66 ± 1.11 2.14 ± 0.44 1.31 ± 0.17 bn111207512 2.62E-07 ± 2.66E-08 3.71 ± 0.77 1.84 ± 0.39 1.14 ± 0.18 bn111208353 3.26E-06 ± 3.87E-08 4.38 ± 1.15 2.75 ± 0.39 2.49 ± 0.19 bn111216389 4.17E-05 ± 9.73E-08 15.85 ± 1.83 12.67 ± 0.87 10.60 ± 0.42 bn111220486 5.36E-05 ± 2.22E-07 44.25 ± 1.70 38.01 ± 0.83 28.97 ± 0.39 bn111221739 3.06E-06 ± 5.72E-08 24.55 ± 1.90 20.68 ± 0.77 10.07 ± 0.38 bn111222619 4.84E-06 ± 4.14E-08 60.16 ± 3.39 44.42 ± 1.45 14.26 ± 0.54 bn111226795 1.15E-05 ± 1.39E-07 4.98 ± 1.10 3.82 ± 0.44 3.37 ± 0.21 bn111228453 2.75E-06 ± 4.27E-08 23.80 ± 1.95 22.40 ± 0.95 20.98 ± 0.44 bn111228657 1.81E-05 ± 5.79E-08 27.58 ± 1.74 24.93 ± 0.89 20.81 ± 0.42 bn111230683 2.90E-06 ± 5.01E-08 8.62 ± 2.11 6.80 ± 0.85 5.49 ± 0.41 bn111230819 3.51E-06 ± 3.95E-08 8.83 ± 1.30 7.46 ± 0.58 5.44 ± 0.27 bn120101354 1.09E-07 ± 1.39E-08 7.44 ± 0.97 3.98 ± 0.44 1.01 ± 0.17

– 162 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120102095 1.34E-05 ± 4.39E-08 22.82 ± 1.57 21.31 ± 0.78 19.04 ± 0.39 bn120102416 2.55E-06 ± 5.74E-08 5.59 ± 1.18 4.80 ± 0.53 4.34 ± 0.29 bn120105584 1.47E-06 ± 3.54E-08 4.57 ± 1.24 3.54 ± 0.54 2.60 ± 0.25 bn120107384 6.53E-06 ± 4.44E-08 8.53 ± 1.10 6.78 ± 0.51 5.50 ± 0.24 bn120109824 1.92E-06 ± 4.17E-08 6.51 ± 1.96 3.58 ± 0.65 2.55 ± 0.39 bn120111051 3.97E-06 ± 5.63E-08 4.19 ± 0.96 2.63 ± 0.45 2.00 ± 0.21 bn120114433 1.49E-07 ± 2.64E-08 3.78 ± 1.06 1.76 ± 0.44 1.10 ± 0.19 bn120114681 2.39E-06 ± 4.20E-08 5.87 ± 1.73 3.36 ± 0.49 2.45 ± 0.29 bn120118709 2.66E-06 ± 4.67E-08 5.21 ± 1.20 4.08 ± 0.48 2.83 ± 0.23 bn120118898 1.62E-06 ± 3.39E-08 13.42 ± 1.31 13.01 ± 0.64 9.00 ± 0.29 bn120119170 3.87E-05 ± 1.36E-07 22.37 ± 1.71 18.85 ± 0.80 16.86 ± 0.39 bn120119229 5.94E-06 ± 3.53E-08 5.36 ± 0.95 5.23 ± 0.40 4.34 ± 0.22 bn120119354 2.61E-06 ± 4.89E-08 4.91 ± 1.25 4.86 ± 0.49 3.80 ± 0.23 bn120120432 1.50E-06 ± 3.35E-08 3.41 ± 1.09 2.63 ± 0.35 1.41 ± 0.21 bn120121101 1.95E-06 ± 3.02E-08 4.21 ± 0.91 3.60 ± 0.45 2.66 ± 0.21 bn120121251 1.15E-05 ± 6.65E-08 9.06 ± 1.55 8.87 ± 0.54 7.10 ± 0.29 bn120122300 2.60E-06 ± 4.84E-08 5.01 ± 1.27 3.53 ± 0.54 3.05 ± 0.24 bn120129312 8.93E-08 ± 1.25E-08 3.32 ± 1.02 2.37 ± 0.49 0.96 ± 0.21 bn120129580 5.45E-05 ± 7.12E-08 212.26 ± 4.67 206.42 ± 2.29 158.63 ± 1.04 bn120130699 6.61E-06 ± 1.41E-07 12.29 ± 1.89 10.60 ± 0.89 8.16 ± 0.41 bn120130906 5.25E-07 ± 3.08E-08 3.84 ± 0.90 3.13 ± 0.46 2.29 ± 0.22 bn120130938 1.04E-05 ± 1.63E-07 8.96 ± 1.55 6.75 ± 0.69 6.19 ± 0.35 bn120203812 1.10E-06 ± 2.89E-08 5.98 ± 1.92 5.15 ± 0.76 3.51 ± 0.35 bn120204054 9.60E-05 ± 8.71E-08 36.54 ± 1.76 35.21 ± 0.93 33.57 ± 0.42 bn120205285 1.11E-07 ± 9.86E-09 2.28 ± 0.62 1.96 ± 0.33 1.08 ± 0.15 bn120206949 5.88E-06 ± 6.31E-08 21.93 ± 1.86 20.15 ± 0.89 17.15 ± 0.43 bn120210650 6.45E-07 ± 1.51E-08 11.07 ± 1.26 10.85 ± 0.44 7.04 ± 0.20 bn120212353 5.09E-08 ± 1.22E-08 5.31 ± 1.15 3.00 ± 0.47 1.22 ± 0.19 bn120212383 1.15E-06 ± 2.59E-08 4.86 ± 1.08 3.98 ± 0.47 3.29 ± 0.22 bn120213606 2.68E-06 ± 5.46E-08 9.38 ± 1.07 7.42 ± 0.53 6.61 ± 0.26 bn120217808 1.75E-06 ± 7.76E-08 12.11 ± 1.93 10.59 ± 0.87 8.94 ± 0.43 bn120217904 4.86E-06 ± 4.05E-08 45.65 ± 2.11 41.79 ± 1.03 24.39 ± 0.43

– 163 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120218276 1.14E-05 ± 8.01E-08 4.59 ± 1.37 3.09 ± 0.61 2.52 ± 0.26 bn120219563 5.58E-07 ± 1.40E-08 2.60 ± 0.83 2.41 ± 0.29 1.57 ± 0.20 bn120220210 1.24E-06 ± 2.48E-08 3.51 ± 1.06 2.25 ± 0.45 1.70 ± 0.22 bn120222021 1.73E-06 ± 2.36E-08 24.02 ± 1.71 22.09 ± 0.84 15.92 ± 0.39 bn120222119 2.45E-06 ± 6.21E-08 5.00 ± 1.11 3.16 ± 0.58 2.10 ± 0.24 bn120223933 3.88E-06 ± 8.80E-08 6.42 ± 1.17 4.27 ± 0.45 3.92 ± 0.23 bn120224282 9.12E-06 ± 2.05E-07 7.27 ± 1.31 6.48 ± 0.55 5.17 ± 0.28 bn120224898 2.60E-06 ± 5.63E-08 4.34 ± 1.12 3.14 ± 0.41 2.55 ± 0.21 bn120226447 5.85E-06 ± 7.85E-08 16.88 ± 3.10 8.72 ± 1.17 7.07 ± 0.49 bn120226871 5.20E-05 ± 9.14E-08 14.73 ± 1.43 12.41 ± 0.67 11.43 ± 0.33 bn120227391 3.74E-06 ± 8.33E-08 7.96 ± 1.99 6.44 ± 0.86 3.77 ± 0.41 bn120227725 2.19E-05 ± 1.04E-07 29.11 ± 5.05 21.20 ± 2.02 18.47 ± 0.91 bn120302080 2.53E-06 ± 5.51E-08 4.81 ± 1.51 3.60 ± 0.45 2.29 ± 0.29 bn120302722 1.19E-07 ± 1.62E-08 6.20 ± 1.49 4.35 ± 0.65 1.96 ± 0.28 bn120304061 5.05E-06 ± 1.99E-08 21.19 ± 1.54 21.19 ± 0.38 18.81 ± 0.29 bn120304248 1.14E-05 ± 4.07E-08 23.35 ± 1.97 16.78 ± 0.83 10.33 ± 0.37 bn120308588 6.72E-06 ± 6.27E-08 19.91 ± 2.39 18.40 ± 0.85 15.91 ± 0.50 bn120312671 8.29E-07 ± 2.72E-08 4.08 ± 1.10 3.10 ± 0.52 1.97 ± 0.24 bn120314412 1.64E-07 ± 3.14E-08 3.29 ± 0.92 3.05 ± 0.41 1.77 ± 0.18 bn120316008 1.63E-05 ± 3.08E-08 12.22 ± 1.31 10.54 ± 0.55 6.83 ± 0.30 bn120319983 2.42E-06 ± 3.96E-08 3.57 ± 1.05 3.03 ± 0.42 1.86 ± 0.19 bn120323162 1.41E-06 ± 2.00E-08 8.54 ± 1.16 6.76 ± 0.54 5.37 ± 0.27 bn120323507 1.08E-05 ± 1.94E-08 574.71 ± 7.79 356.06 ± 3.04 117.92 ± 0.87 bn120326056 3.26E-06 ± 4.84E-08 10.49 ± 1.26 8.62 ± 0.59 7.74 ± 0.28 bn120327418 1.14E-07 ± 3.65E-08 7.94 ± 1.76 5.08 ± 0.77 1.71 ± 0.29 bn120328268 7.50E-05 ± 1.66E-07 38.00 ± 1.68 36.95 ± 0.82 33.58 ± 0.40 bn120331055 6.77E-07 ± 5.20E-08 40.83 ± 3.54 16.32 ± 1.30 4.20 ± 0.42 bn120402669 3.75E-06 ± 2.61E-08 20.21 ± 2.13 18.39 ± 0.99 16.82 ± 0.47 bn120403857 2.40E-07 ± 2.05E-08 2.61 ± 1.03 2.25 ± 0.25 1.75 ± 0.24 bn120410585 2.91E-07 ± 2.11E-08 8.76 ± 1.07 5.44 ± 0.47 1.46 ± 0.18 bn120411925 1.46E-06 ± 2.75E-08 4.24 ± 1.13 2.85 ± 0.41 1.74 ± 0.22 bn120412055 1.25E-06 ± 8.58E-08 3.90 ± 1.07 2.78 ± 0.47 2.23 ± 0.21

– 164 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120412920 7.03E-06 ± 5.27E-08 9.52 ± 1.42 8.25 ± 0.66 7.70 ± 0.33 bn120415076 2.23E-06 ± 5.69E-08 5.48 ± 1.00 4.80 ± 0.53 4.47 ± 0.26 bn120415891 1.30E-07 ± 9.03E-09 4.57 ± 1.11 4.56 ± 0.37 1.99 ± 0.18 bn120415958 2.31E-06 ± 5.47E-08 9.74 ± 2.34 6.93 ± 1.06 5.97 ± 0.50 bn120420249 2.88E-06 ± 5.99E-08 6.53 ± 1.35 5.36 ± 0.58 4.55 ± 0.29 bn120420858 4.33E-05 ± 2.14E-07 6.83 ± 1.42 6.09 ± 0.72 4.81 ± 0.33 bn120426090 2.03E-05 ± 8.69E-08 87.96 ± 3.24 84.66 ± 1.60 77.61 ± 0.77 bn120426585 3.66E-06 ± 4.17E-08 5.36 ± 1.21 3.40 ± 0.38 2.35 ± 0.20 bn120427054 7.42E-06 ± 5.91E-08 18.49 ± 1.66 16.43 ± 0.78 14.78 ± 0.37 bn120427153 6.81E-07 ± 3.74E-08 3.07 ± 1.06 2.67 ± 0.45 1.71 ± 0.22 bn120429003 2.79E-07 ± 2.36E-08 5.18 ± 1.11 4.07 ± 0.47 3.10 ± 0.24 bn120429484 2.37E-06 ± 1.75E-08 4.94 ± 0.99 3.42 ± 0.46 3.06 ± 0.22 bn120430980 5.56E-07 ± 2.07E-08 3.01 ± 1.07 2.19 ± 0.45 1.66 ± 0.23 bn120504468 3.36E-06 ± 2.63E-08 5.37 ± 1.12 3.44 ± 0.47 2.44 ± 0.22 bn120504945 1.67E-06 ± 2.71E-08 4.98 ± 1.33 3.09 ± 0.53 2.43 ± 0.24 bn120506128 2.87E-07 ± 2.51E-08 4.03 ± 1.07 2.86 ± 0.48 2.42 ± 0.22 bn120509619 1.55E-07 ± 1.35E-08 3.59 ± 0.85 3.27 ± 0.40 1.51 ± 0.19 bn120510900 6.01E-06 ± 7.63E-08 5.46 ± 1.82 3.95 ± 0.69 2.82 ± 0.31 bn120511638 1.14E-05 ± 9.51E-08 9.92 ± 2.66 6.66 ± 0.97 4.68 ± 0.42 bn120512112 1.24E-05 ± 7.12E-08 8.74 ± 1.11 7.42 ± 0.48 6.93 ± 0.24 bn120513531 1.31E-06 ± 3.78E-08 3.88 ± 1.01 2.94 ± 0.44 1.97 ± 0.20 bn120519721 2.41E-06 ± 2.49E-08 12.72 ± 1.40 9.27 ± 0.51 6.71 ± 0.27 bn120520949 4.41E-07 ± 1.41E-08 1.70 ± 0.35 1.32 ± 0.18 1.06 ± 0.09 bn120521380 3.11E-06 ± 7.23E-08 4.87 ± 1.68 2.37 ± 0.51 1.55 ± 0.23 bn120522361 9.32E-06 ± 5.08E-08 17.02 ± 2.16 16.33 ± 1.08 15.23 ± 0.52 bn120524134 2.53E-07 ± 1.51E-08 17.66 ± 2.02 13.20 ± 1.00 4.52 ± 0.35 bn120526303 1.16E-04 ± 2.28E-07 23.79 ± 5.80 19.76 ± 2.39 15.69 ± 1.10 bn120528442 3.79E-06 ± 4.57E-08 7.41 ± 1.35 6.55 ± 0.44 5.55 ± 0.27 bn120530121 7.17E-06 ± 5.01E-08 7.11 ± 1.53 5.84 ± 0.66 5.09 ± 0.31 bn120531393 9.10E-07 ± 1.79E-08 3.44 ± 1.10 2.28 ± 0.40 1.86 ± 0.21 bn120603439 6.79E-07 ± 2.69E-08 13.70 ± 1.26 9.74 ± 0.57 3.23 ± 0.25 bn120604220 1.23E-06 ± 5.10E-08 6.72 ± 1.23 5.90 ± 0.65 3.52 ± 0.25

– 165 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120604343 1.51E-06 ± 7.23E-08 4.11 ± 1.40 3.36 ± 0.25 2.40 ± 0.19 bn120605453 3.25E-06 ± 5.42E-08 12.14 ± 1.68 11.41 ± 0.80 9.65 ± 0.38 bn120608489 4.83E-07 ± 2.14E-08 6.82 ± 1.27 6.21 ± 0.53 3.26 ± 0.25 bn120608777 3.17E-06 ± 4.30E-08 4.99 ± 1.46 4.42 ± 0.48 3.66 ± 0.21 bn120609580 4.20E-07 ± 2.53E-08 5.05 ± 1.11 4.08 ± 0.52 3.68 ± 0.24 bn120611108 4.53E-06 ± 4.85E-08 8.10 ± 1.25 6.63 ± 0.55 4.53 ± 0.24 bn120612680 2.06E-06 ± 2.72E-08 5.47 ± 1.40 3.81 ± 0.55 2.26 ± 0.26 bn120612687 7.05E-07 ± 2.22E-08 11.04 ± 1.23 7.68 ± 0.49 2.58 ± 0.23 bn120616630 2.58E-07 ± 1.16E-08 7.23 ± 1.06 2.85 ± 0.52 0.77 ± 0.23 bn120618128 5.58E-06 ± 6.84E-08 6.14 ± 1.06 4.94 ± 0.41 4.67 ± 0.40 bn120618919 3.63E-06 ± 5.69E-08 8.67 ± 1.94 7.55 ± 0.98 4.45 ± 0.39 bn120619884 4.24E-07 ± 3.02E-08 4.15 ± 0.99 3.38 ± 0.41 1.80 ± 0.18 bn120624309 5.14E-06 ± 7.61E-08 76.84 ± 2.17 57.22 ± 1.06 19.40 ± 0.38 bn120624933 1.92E-04 ± 1.98E-07 21.25 ± 1.26 19.76 ± 0.63 17.67 ± 0.30 bn120625119 1.02E-05 ± 4.25E-08 22.07 ± 1.94 19.94 ± 0.93 18.37 ± 0.46 bn120629565 5.19E-08 ± 1.21E-08 3.39 ± 0.87 2.11 ± 0.36 0.98 ± 0.17 bn120701654 8.36E-08 ± 6.30E-08 6.68 ± 2.13 4.50 ± 1.02 1.76 ± 0.45 bn120702891 1.60E-06 ± 5.81E-08 3.16 ± 1.10 2.31 ± 0.40 1.68 ± 0.21 bn120703417 1.11E-05 ± 5.19E-08 10.06 ± 1.36 8.28 ± 0.63 7.64 ± 0.32 bn120703498 2.60E-06 ± 5.35E-08 4.80 ± 1.37 3.95 ± 0.54 2.54 ± 0.27 bn120703726 8.33E-06 ± 9.83E-08 19.75 ± 1.19 18.73 ± 0.61 17.18 ± 0.30 bn120707800 9.36E-05 ± 7.07E-07 76.70 ± 7.13 67.09 ± 3.37 60.33 ± 1.59 bn120709883 1.37E-05 ± 3.75E-08 18.35 ± 1.41 15.39 ± 0.65 11.05 ± 0.29 bn120710100 5.34E-06 ± 2.12E-08 6.56 ± 1.35 4.64 ± 0.55 3.80 ± 0.25 bn120711115 1.94E-04 ± 2.28E-07 44.67 ± 2.81 31.57 ± 1.22 26.72 ± 0.58 bn120711446 1.86E-06 ± 2.04E-08 3.83 ± 1.18 2.26 ± 0.36 1.28 ± 0.17 bn120712571 4.43E-06 ± 4.51E-08 5.51 ± 1.11 3.84 ± 0.49 3.49 ± 0.22 bn120713226 1.13E-06 ± 1.07E-07 4.39 ± 1.28 2.70 ± 0.51 2.39 ± 0.25 bn120715066 2.20E-06 ± 3.63E-08 4.91 ± 1.14 3.56 ± 0.50 2.61 ± 0.22 bn120716577 5.22E-06 ± 1.25E-07 6.00 ± 1.91 3.81 ± 0.62 3.45 ± 0.32 bn120716712 1.44E-05 ± 4.10E-08 15.02 ± 1.47 13.93 ± 0.72 8.61 ± 0.31 bn120719146 1.35E-05 ± 8.35E-08 8.23 ± 1.48 6.81 ± 0.72 5.80 ± 0.33

– 166 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120727354 1.09E-07 ± 2.16E-08 3.04 ± 0.87 1.75 ± 0.42 1.14 ± 0.20 bn120727681 9.23E-06 ± 7.38E-08 18.27 ± 1.66 16.82 ± 0.78 15.74 ± 0.38 bn120728434 1.16E-04 ± 2.54E-06 46.75 ± 2.51 43.49 ± 1.19 40.87 ± 0.58 bn120728934 3.74E-06 ± 4.60E-08 5.88 ± 1.51 4.94 ± 0.35 3.58 ± 0.28 bn120729456 5.08E-06 ± 5.30E-08 6.61 ± 1.28 5.76 ± 0.61 5.20 ± 0.30 bn120801920 3.34E-05 ± 2.63E-07 34.72 ± 30.71 21.06 ± 8.16 15.96 ± 2.58 bn120805706 1.88E-07 ± 1.96E-08 2.72 ± 1.03 2.43 ± 0.35 2.04 ± 0.23 bn120806007 4.90E-06 ± 3.69E-08 9.52 ± 1.26 8.65 ± 0.61 7.72 ± 0.30 bn120811014 2.27E-06 ± 1.94E-08 20.99 ± 1.31 12.05 ± 0.59 4.64 ± 0.24 bn120811649 3.45E-06 ± 2.11E-07 13.67 ± 2.82 11.64 ± 0.70 7.70 ± 0.45 bn120814201 3.83E-07 ± 3.94E-08 10.74 ± 2.64 7.86 ± 1.10 5.15 ± 0.49 bn120814803 1.28E-07 ± 3.48E-08 3.89 ± 0.82 2.70 ± 0.34 0.61 ± 0.14 bn120817057 1.04E-06 ± 2.96E-08 4.05 ± 1.17 2.40 ± 0.46 1.20 ± 0.23 bn120817168 1.79E-06 ± 1.02E-08 47.03 ± 2.08 20.85 ± 0.76 5.80 ± 0.25 bn120819048 1.33E-06 ± 3.27E-08 4.83 ± 1.08 3.23 ± 0.42 2.61 ± 0.22 bn120820585 6.98E-06 ± 2.93E-08 11.99 ± 9.88 11.99 ± 2.47 4.36 ± 0.64 bn120822628 1.09E-07 ± 1.70E-08 3.36 ± 0.92 2.07 ± 0.44 1.29 ± 0.19 bn120824594 5.92E-06 ± 4.16E-08 3.63 ± 1.28 2.39 ± 0.50 1.69 ± 0.21 bn120827216 3.37E-06 ± 9.12E-08 8.11 ± 1.85 6.00 ± 0.69 5.01 ± 0.34 bn120830212 7.52E-06 ± 2.36E-07 14.84 ± 2.02 13.56 ± 0.97 8.66 ± 0.45 bn120830297 3.07E-06 ± 2.72E-08 10.50 ± 0.93 9.01 ± 0.51 7.19 ± 0.24 bn120830702 5.66E-06 ± 3.34E-08 6.57 ± 1.16 5.51 ± 0.53 4.36 ± 0.23 bn120831901 2.51E-07 ± 2.95E-08 9.95 ± 1.35 5.85 ± 0.60 1.93 ± 0.25 bn120905657 1.96E-05 ± 6.32E-07 5.09 ± 1.03 3.82 ± 0.48 3.55 ± 0.23 bn120907017 8.09E-07 ± 4.08E-08 7.56 ± 1.95 6.60 ± 0.91 4.28 ± 0.36 bn120908873 1.27E-05 ± 8.54E-08 9.02 ± 1.74 6.88 ± 0.79 6.20 ± 0.39 bn120908938 5.16E-06 ± 1.12E-07 5.19 ± 2.37 3.55 ± 0.52 2.60 ± 0.24 bn120909070 9.85E-06 ± 1.54E-07 4.38 ± 1.01 3.83 ± 0.34 3.03 ± 0.19 bn120911298 2.34E-06 ± 4.25E-08 6.98 ± 1.60 5.76 ± 0.64 4.31 ± 0.27 bn120913846 1.56E-06 ± 2.56E-08 6.45 ± 1.36 5.24 ± 0.49 4.44 ± 0.24 bn120913997 2.03E-05 ± 7.55E-08 7.39 ± 1.25 6.33 ± 0.61 5.27 ± 0.28 bn120914144 7.35E-07 ± 3.53E-08 4.80 ± 1.11 4.25 ± 0.64 3.58 ± 0.30

– 167 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120915000 5.05E-07 ± 2.55E-08 6.04 ± 0.93 4.42 ± 0.48 2.25 ± 0.22 bn120915474 3.83E-07 ± 2.47E-08 3.71 ± 1.11 2.04 ± 0.44 1.24 ± 0.21 bn120916085 7.33E-08 ± 1.04E-08 4.14 ± 0.85 2.47 ± 0.30 1.13 ± 0.15 bn120916173 1.42E-05 ± 5.38E-08 3.57 ± 1.17 12.89 ± 0.68 10.22 ± 0.30 bn120919052 2.07E-05 ± 3.81E-08 13.73 ± 1.29 12.15 ± 0.62 8.99 ± 0.30 bn120919309 1.68E-05 ± 5.24E-08 28.14 ± 1.47 27.57 ± 0.72 24.52 ± 0.34 bn120919816 1.14E-06 ± 2.21E-08 5.68 ± 1.05 4.46 ± 0.48 3.14 ± 0.22 bn120920003 1.00E-06 ± 3.15E-08 3.32 ± 1.00 1.80 ± 0.39 1.14 ± 0.18 bn120921877 2.48E-06 ± 3.10E-08 12.34 ± 1.49 11.75 ± 0.77 10.32 ± 0.39 bn120922939 8.21E-06 ± 1.69E-07 5.63 ± 1.43 4.29 ± 0.70 3.41 ± 0.28 bn120926335 2.48E-06 ± 4.82E-08 18.62 ± 1.35 15.84 ± 0.65 12.04 ± 0.34 bn120926426 4.38E-06 ± 9.17E-08 6.99 ± 1.45 5.21 ± 0.66 3.94 ± 0.30 bn120926753 1.88E-07 ± 2.43E-08 3.49 ± 1.01 1.55 ± 0.49 1.18 ± 0.21 bn121004211 3.79E-07 ± 1.06E-08 5.84 ± 1.24 4.67 ± 0.60 3.48 ± 0.27 bn121005030 3.73E-06 ± 6.35E-08 7.10 ± 1.98 3.80 ± 0.96 2.78 ± 0.34 bn121005340 5.17E-06 ± 5.38E-08 4.37 ± 1.11 3.28 ± 0.35 2.67 ± 0.21 bn121008424 3.92E-07 ± 1.09E-08 4.86 ± 1.34 3.87 ± 0.62 2.73 ± 0.26 bn121011469 3.98E-06 ± 3.63E-08 3.73 ± 1.03 2.70 ± 0.43 2.17 ± 0.20 bn121012724 1.27E-06 ± 1.00E-08 12.41 ± 1.09 10.55 ± 0.52 4.31 ± 0.19 bn121014638 1.30E-07 ± 2.16E-08 3.27 ± 0.99 3.03 ± 0.43 1.38 ± 0.18 bn121019233 5.89E-07 ± 8.36E-08 4.43 ± 1.13 1.97 ± 0.32 1.23 ± 0.20 bn121023322 7.73E-07 ± 3.83E-08 11.02 ± 1.38 8.58 ± 0.63 4.62 ± 0.27 bn121027038 7.39E-06 ± 6.53E-08 7.16 ± 1.95 4.74 ± 0.75 2.92 ± 0.38 bn121028280 9.98E-07 ± 2.83E-08 4.56 ± 1.25 3.47 ± 0.54 2.77 ± 0.25 bn121029350 7.81E-06 ± 5.80E-08 18.10 ± 1.17 16.01 ± 0.58 13.25 ± 0.30 bn121031949 1.45E-05 ± 1.38E-07 16.43 ± 19.41 9.06 ± 2.14 7.44 ± 0.74 bn121102064 5.67E-07 ± 6.23E-08 3.27 ± 1.18 2.54 ± 0.41 1.98 ± 0.24 bn121104627 4.45E-06 ± 1.17E-07 4.83 ± 1.09 3.55 ± 0.51 3.28 ± 0.24 bn121109338 5.34E-06 ± 6.54E-08 6.17 ± 1.67 5.04 ± 0.67 4.30 ± 0.32 bn121112806 2.23E-07 ± 3.22E-08 3.74 ± 0.78 2.43 ± 0.38 1.45 ± 0.17 bn121113544 2.68E-05 ± 7.82E-08 10.81 ± 1.41 9.31 ± 0.69 7.40 ± 0.31 bn121116459 4.92E-07 ± 1.38E-08 7.26 ± 1.28 5.19 ± 0.79 3.33 ± 0.35

– 168 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn121117018 1.06E-05 ± 6.82E-08 6.20 ± 0.98 5.50 ± 0.52 4.64 ± 0.24 bn121118576 6.71E-06 ± 3.54E-08 29.94 ± 1.51 23.62 ± 0.73 11.60 ± 0.31 bn121119579 8.81E-07 ± 2.36E-08 9.58 ± 1.27 8.01 ± 0.61 5.37 ± 0.28 bn121122564 8.15E-07 ± 1.79E-08 6.13 ± 1.09 5.39 ± 0.52 4.40 ± 0.21 bn121122870 9.07E-06 ± 5.99E-08 7.22 ± 1.23 6.62 ± 0.43 5.12 ± 0.27 bn121122885 3.85E-05 ± 1.55E-07 46.51 ± 8.06 41.88 ± 3.42 36.72 ± 1.65 bn121123421 2.20E-05 ± 7.88E-07 5.55 ± 1.11 4.67 ± 0.51 4.00 ± 0.25 bn121123442 1.42E-05 ± 1.03E-07 8.98 ± 1.33 7.78 ± 0.53 6.36 ± 0.29 bn121124606 5.66E-08 ± 1.42E-08 5.33 ± 1.25 2.83 ± 0.55 0.85 ± 0.22 bn121125356 6.56E-06 ± 6.75E-08 6.57 ± 1.30 5.29 ± 0.55 4.16 ± 0.26 bn121125469 8.57E-07 ± 2.65E-08 3.28 ± 1.01 3.08 ± 0.48 2.24 ± 0.19 bn121127914 1.58E-06 ± 4.98E-08 20.36 ± 1.66 13.63 ± 0.81 4.63 ± 0.30 bn121128212 9.30E-06 ± 1.14E-07 26.18 ± 2.35 22.69 ± 1.13 17.89 ± 0.52 bn121202181 2.01E-06 ± 5.13E-08 4.09 ± 1.34 3.64 ± 0.25 1.95 ± 0.17 bn121205507 1.33E-07 ± 7.51E-09 3.98 ± 1.36 2.53 ± 0.48 1.08 ± 0.22 bn121210081 2.02E-06 ± 6.07E-08 5.26 ± 1.53 3.09 ± 0.36 1.81 ± 0.21 bn121211574 6.41E-07 ± 3.95E-08 4.30 ± 1.07 3.00 ± 0.51 2.37 ± 0.24 bn121211695 1.34E-06 ± 3.65E-08 6.24 ± 1.16 5.01 ± 0.52 4.58 ± 0.24 bn121216419 3.85E-07 ± 2.48E-08 3.50 ± 1.07 2.94 ± 0.44 1.85 ± 0.20 bn121217313 6.77E-06 ± 6.56E-08 5.23 ± 1.24 3.80 ± 0.59 3.36 ± 0.27 bn121220311 4.53E-07 ± 2.78E-08 2.73 ± 0.93 1.75 ± 0.49 1.21 ± 0.19 bn121221916 5.04E-06 ± 4.99E-08 6.01 ± 1.05 4.51 ± 0.35 3.97 ± 0.22 bn121223300 7.02E-06 ± 1.99E-08 9.40 ± 1.07 8.29 ± 0.49 7.74 ± 0.24 bn121225417 6.96E-05 ± 1.91E-07 29.88 ± 1.81 27.92 ± 0.89 23.61 ± 0.41 bn121229533 3.51E-06 ± 3.71E-08 6.09 ± 1.16 4.29 ± 0.46 3.64 ± 0.24 bn121231445 2.94E-06 ± 7.22E-08 5.98 ± 1.25 3.79 ± 0.52 2.79 ± 0.26 bn130104721 5.67E-06 ± 5.63E-08 8.80 ± 1.23 7.77 ± 0.61 6.68 ± 0.29 bn130106829 1.59E-06 ± 4.32E-08 4.54 ± 1.07 3.83 ± 0.50 3.37 ± 0.24 bn130106995 1.54E-05 ± 6.80E-08 10.51 ± 1.80 8.60 ± 0.70 7.37 ± 0.44 bn130109206 2.54E-06 ± 6.78E-08 8.80 ± 1.11 7.85 ± 0.54 6.76 ± 0.26 bn130112286 2.61E-06 ± 4.69E-08 9.64 ± 1.12 8.47 ± 0.54 5.70 ± 0.24 bn130112353 1.24E-06 ± 2.98E-08 8.60 ± 1.17 6.73 ± 0.56 4.42 ± 0.25

– 169 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130114019 1.11E-06 ± 7.53E-08 4.92 ± 1.04 4.11 ± 0.51 3.03 ± 0.22 bn130115716 2.72E-06 ± 3.21E-08 5.62 ± 1.10 4.14 ± 0.55 3.44 ± 0.24 bn130116415 9.27E-07 ± 3.48E-08 5.19 ± 1.49 2.83 ± 0.65 1.60 ± 0.25 bn130117087 2.85E-06 ± 3.54E-08 4.29 ± 1.27 2.47 ± 0.45 1.73 ± 0.21 bn130118482 8.28E-07 ± 3.77E-08 3.27 ± 1.04 3.27 ± 0.26 1.47 ± 0.23 bn130121835 4.34E-05 ± 1.11E-07 31.74 ± 2.50 28.96 ± 1.25 22.76 ± 0.59 bn130123843 1.49E-06 ± 3.34E-08 5.71 ± 1.25 4.99 ± 0.59 4.12 ± 0.27 bn130127299 1.02E-06 ± 5.89E-08 3.40 ± 1.14 2.48 ± 0.37 1.67 ± 0.23 bn130127743 2.32E-07 ± 1.13E-08 7.31 ± 0.88 3.64 ± 0.34 0.79 ± 0.12 bn130131511 3.92E-05 ± 7.16E-08 11.41 ± 1.68 9.72 ± 0.77 7.68 ± 0.35 bn130204484 2.81E-07 ± 1.09E-08 9.12 ± 1.02 4.30 ± 0.46 1.12 ± 0.18 bn130206482 7.16E-06 ± 6.08E-08 16.76 ± 1.20 16.12 ± 0.59 14.59 ± 0.29 bn130206817 2.57E-06 ± 7.05E-08 5.72 ± 1.66 3.97 ± 0.64 2.14 ± 0.24 bn130208684 2.25E-06 ± 5.01E-08 3.66 ± 0.90 2.75 ± 0.40 2.06 ± 0.18 bn130209961 6.12E-06 ± 1.87E-08 13.41 ± 1.35 11.63 ± 0.62 7.89 ± 0.28 bn130213905 9.87E-07 ± 4.97E-08 3.82 ± 1.25 2.63 ± 0.63 2.02 ± 0.26 bn130214137 1.59E-06 ± 1.07E-07 3.11 ± 1.15 1.94 ± 0.37 1.43 ± 0.18 bn130214800 5.98E-06 ± 9.10E-08 10.35 ± 1.36 9.08 ± 0.56 8.28 ± 0.28 bn130215063 1.86E-05 ± 3.27E-07 5.18 ± 1.15 4.39 ± 0.56 3.47 ± 0.28 bn130215649 2.15E-05 ± 6.04E-08 10.86 ± 2.28 9.80 ± 0.92 8.46 ± 0.44 bn130216790 4.89E-06 ± 3.57E-08 20.26 ± 1.99 19.39 ± 0.98 15.25 ± 0.42 bn130216927 5.92E-06 ± 6.06E-08 12.57 ± 1.25 10.30 ± 0.60 9.20 ± 0.29 bn130217688 1.10E-06 ± 5.45E-08 6.98 ± 1.35 5.68 ± 0.65 4.54 ± 0.31 bn130218261 9.43E-06 ± 1.06E-07 11.60 ± 2.66 9.76 ± 1.24 8.05 ± 0.52 bn130219197 3.19E-05 ± 1.03E-07 6.55 ± 2.43 5.40 ± 0.42 4.58 ± 0.25 bn130219626 2.03E-07 ± 1.98E-08 6.47 ± 1.13 3.58 ± 0.49 1.04 ± 0.20 bn130219775 2.85E-05 ± 7.33E-08 17.11 ± 1.62 15.76 ± 0.76 15.03 ± 0.37 bn130220964 7.24E-06 ± 4.58E-08 28.42 ± 1.54 27.53 ± 0.77 25.27 ± 0.37 bn130224370 4.96E-06 ± 5.94E-08 5.96 ± 1.09 5.04 ± 0.50 3.96 ± 0.22 bn130228111 6.96E-06 ± 5.06E-08 6.80 ± 1.38 4.71 ± 0.61 4.28 ± 0.29 bn130228212 1.75E-05 ± 1.46E-07 36.20 ± 4.40 31.65 ± 2.03 25.58 ± 0.95 bn130304410 3.70E-05 ± 9.15E-08 16.53 ± 3.77 12.17 ± 1.28 9.69 ± 0.57

– 170 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130304658 1.62E-06 ± 4.08E-08 4.97 ± 1.61 3.36 ± 0.66 2.58 ± 0.31 bn130305486 4.65E-05 ± 7.18E-08 30.10 ± 1.54 27.55 ± 0.76 26.77 ± 0.38 bn130305526 1.52E-06 ± 4.61E-08 3.55 ± 0.90 2.09 ± 0.29 1.08 ± 0.20 bn130306991 1.25E-04 ± 7.20E-07 42.10 ± 8.11 36.36 ± 2.77 29.42 ± 1.62 bn130307126 4.79E-07 ± 6.81E-09 9.93 ± 1.15 8.25 ± 0.47 3.61 ± 0.17 bn130307238 3.97E-06 ± 5.85E-08 5.24 ± 1.67 3.45 ± 0.59 2.43 ± 0.28 bn130310840 1.13E-05 ± 6.71E-08 172.82 ± 3.36 90.41 ± 1.25 39.29 ± 0.45 bn130314147 1.46E-05 ± 4.67E-08 7.49 ± 1.36 5.34 ± 0.40 4.80 ± 0.26 bn130318456 3.20E-06 ± 4.87E-08 7.38 ± 1.95 5.61 ± 0.74 3.88 ± 0.40 bn130320560 8.12E-05 ± 1.74E-06 200.59 ± 4.88 191.98 ± 2.36 184.03 ± 1.16 bn130324042 2.06E-06 ± 3.05E-08 3.41 ± 1.35 1.95 ± 0.41 1.26 ± 0.17 bn130325005 5.66E-08 ± 1.39E-08 6.13 ± 1.04 2.53 ± 0.41 0.86 ± 0.17 bn130325203 7.44E-06 ± 2.94E-08 15.29 ± 1.13 14.40 ± 0.55 12.70 ± 0.26 bn130327350 5.20E-05 ± 8.06E-08 16.77 ± 1.31 14.51 ± 0.67 12.59 ± 0.32 bn130331566 9.33E-06 ± 5.05E-08 17.76 ± 2.09 16.30 ± 0.87 14.69 ± 0.47 bn130403866 1.09E-06 ± 6.93E-08 4.63 ± 2.40 1.80 ± 0.42 1.30 ± 0.21 bn130404428 8.43E-07 ± 4.45E-08 7.02 ± 1.08 5.44 ± 0.57 4.07 ± 0.26 bn130404840 8.36E-06 ± 5.95E-08 14.61 ± 1.67 12.77 ± 0.79 11.24 ± 0.37 bn130404877 2.20E-07 ± 5.61E-08 4.09 ± 1.05 2.82 ± 0.46 1.22 ± 0.19 bn130406288 2.92E-06 ± 5.14E-08 20.01 ± 1.60 15.99 ± 0.77 12.84 ± 0.36 bn130406334 3.21E-06 ± 1.06E-07 7.46 ± 1.65 5.07 ± 0.66 3.65 ± 0.34 bn130406354 2.98E-07 ± 2.90E-08 3.45 ± 1.17 1.92 ± 0.38 1.34 ± 0.15 bn130407800 1.75E-06 ± 4.95E-08 2.76 ± 0.87 2.53 ± 0.40 1.58 ± 0.18 bn130408653 2.05E-06 ± 4.83E-08 8.24 ± 1.66 7.58 ± 0.80 5.76 ± 0.37 bn130409960 7.87E-06 ± 5.19E-08 10.56 ± 1.33 9.89 ± 0.64 8.73 ± 0.30 bn130416690 2.81E-07 ± 1.62E-08 3.22 ± 0.83 2.03 ± 0.42 1.51 ± 0.17 bn130416770 9.39E-07 ± 1.79E-08 23.59 ± 1.43 10.36 ± 0.59 3.20 ± 0.24 bn130418844 5.98E-06 ± 3.39E-08 8.27 ± 1.35 5.56 ± 0.64 4.71 ± 0.28 bn130420313 1.16E-05 ± 2.43E-07 9.28 ± 2.11 6.74 ± 0.92 5.41 ± 0.46 bn130420343 8.92E-06 ± 6.06E-08 10.52 ± 1.25 8.17 ± 0.38 7.60 ± 0.25 bn130420422 3.77E-06 ± 4.59E-08 8.87 ± 1.90 6.94 ± 0.80 5.38 ± 0.37 bn130420539 1.60E-06 ± 5.77E-08 3.90 ± 1.18 2.69 ± 0.39 2.40 ± 0.21

– 171 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130425327 4.17E-05 ± 1.59E-07 29.09 ± 4.80 25.37 ± 2.28 23.72 ± 1.14 bn130427324 2.46E-03 ± 1.24E-06 1259.22 ± 10.51 1210.15 ± 4.85 1051.86 ± 2.21 bn130502327 1.05E-04 ± 6.43E-08 81.85 ± 2.51 70.17 ± 1.18 45.81 ± 0.49 bn130502743 6.27E-07 ± 3.47E-08 6.60 ± 1.44 6.33 ± 0.72 3.98 ± 0.32 bn130503214 3.86E-08 ± 8.88E-09 5.26 ± 1.05 1.80 ± 0.34 0.40 ± 0.13 bn130504314 4.81E-06 ± 3.39E-08 40.48 ± 2.25 30.94 ± 0.94 12.43 ± 0.32 bn130504978 1.29E-04 ± 2.32E-07 53.42 ± 2.16 51.26 ± 1.07 43.29 ± 0.52 bn130505955 9.87E-06 ± 2.82E-07 6.61 ± 1.36 5.20 ± 0.62 4.09 ± 0.27 bn130507545 4.27E-06 ± 4.67E-08 4.66 ± 1.09 3.67 ± 0.50 2.62 ± 0.23 bn130509078 9.01E-06 ± 6.05E-08 16.97 ± 1.77 14.51 ± 0.81 13.23 ± 0.39 bn130509839 1.52E-06 ± 2.08E-08 3.65 ± 1.43 1.84 ± 0.44 1.27 ± 0.21 bn130510877 3.21E-06 ± 7.18E-08 6.03 ± 1.48 4.93 ± 0.64 3.70 ± 0.30 bn130514560 2.27E-06 ± 4.58E-08 9.23 ± 2.00 7.06 ± 0.83 6.46 ± 0.43 bn130515056 1.09E-06 ± 1.58E-08 20.60 ± 2.33 12.90 ± 1.03 3.73 ± 0.35 bn130515430 1.01E-06 ± 4.32E-08 4.60 ± 1.76 2.13 ± 0.56 1.37 ± 0.24 bn130515755 6.80E-07 ± 2.28E-08 5.55 ± 1.21 5.12 ± 0.51 4.24 ± 0.26 bn130517781 1.97E-05 ± 7.86E-08 11.89 ± 1.54 10.29 ± 0.71 9.41 ± 0.34 bn130518551 3.73E-06 ± 4.91E-08 19.81 ± 1.08 13.64 ± 0.51 7.39 ± 0.23 bn130518580 9.46E-05 ± 1.54E-07 53.97 ± 1.83 49.76 ± 0.91 45.39 ± 0.44 bn130522510 3.99E-06 ± 3.33E-08 10.52 ± 1.40 8.85 ± 0.67 7.08 ± 0.27 bn130523095 6.03E-06 ± 5.79E-08 14.47 ± 2.04 12.78 ± 0.94 11.05 ± 0.45 bn130523198 2.71E-06 ± 3.10E-08 13.45 ± 1.37 10.50 ± 0.67 9.41 ± 0.31 bn130527627 1.09E-05 ± 5.76E-08 6.96 ± 1.30 5.11 ± 0.60 4.48 ± 0.27 bn130528503 3.33E-06 ± 2.50E-08 4.51 ± 1.24 3.94 ± 0.57 3.03 ± 0.24 bn130528695 1.11E-05 ± 1.20E-07 7.54 ± 1.38 6.74 ± 0.60 5.67 ± 0.27 bn130530719 6.33E-06 ± 3.94E-08 8.74 ± 1.55 6.00 ± 0.64 4.59 ± 0.29 bn130604033 1.75E-05 ± 1.31E-07 20.00 ± 1.66 16.84 ± 0.79 13.24 ± 0.37 bn130606316 9.36E-06 ± 3.93E-08 15.37 ± 1.40 13.81 ± 0.68 11.40 ± 0.32 bn130606497 2.01E-04 ± 2.05E-07 79.36 ± 2.55 71.32 ± 1.22 62.14 ± 0.58 bn130609129 1.06E-06 ± 8.22E-08 4.31 ± 1.00 3.63 ± 0.51 3.20 ± 0.23 bn130609902 5.44E-05 ± 3.30E-07 18.61 ± 1.82 16.81 ± 0.90 14.36 ± 0.43 bn130610133 3.54E-06 ± 4.60E-08 5.21 ± 1.53 3.55 ± 0.60 2.86 ± 0.25

– 172 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130611538 7.44E-06 ± 1.00E-07 4.02 ± 1.26 2.70 ± 0.43 2.04 ± 0.22 bn130612141 6.80E-07 ± 6.26E-08 4.39 ± 1.14 4.21 ± 0.27 3.57 ± 0.17 bn130612456 8.33E-06 ± 4.04E-08 32.68 ± 1.88 31.13 ± 0.93 28.01 ± 0.44 bn130614997 6.72E-06 ± 9.66E-08 26.09 ± 1.87 24.08 ± 0.95 20.69 ± 0.45 bn130615398 2.74E-06 ± 1.52E-07 6.06 ± 1.84 3.66 ± 0.68 2.86 ± 0.37 bn130617564 2.41E-07 ± 1.83E-08 7.55 ± 2.19 6.21 ± 0.90 4.13 ± 0.41 bn130620498 1.18E-06 ± 5.58E-08 4.48 ± 0.91 3.72 ± 0.44 3.38 ± 0.21 bn130622615 4.32E-07 ± 2.80E-08 5.67 ± 1.05 4.56 ± 0.46 3.20 ± 0.21 bn130623130 9.45E-07 ± 1.83E-08 5.09 ± 1.16 3.41 ± 0.48 2.63 ± 0.25 bn130623396 1.07E-06 ± 4.83E-08 2.94 ± 0.89 1.72 ± 0.38 1.11 ± 0.18 bn130623488 2.46E-06 ± 3.00E-08 8.35 ± 1.28 6.83 ± 0.43 5.26 ± 0.23 bn130623699 7.04E-07 ± 3.66E-08 3.55 ± 1.43 2.75 ± 0.62 1.79 ± 0.28 bn130623790 8.69E-06 ± 5.45E-08 14.01 ± 1.80 11.77 ± 0.87 10.38 ± 0.42 bn130624093 5.19E-07 ± 2.09E-08 2.63 ± 0.97 1.48 ± 0.23 0.94 ± 0.10 bn130626452 2.34E-07 ± 8.39E-09 6.17 ± 1.08 4.27 ± 0.48 1.44 ± 0.22 bn130626596 4.82E-06 ± 3.27E-08 6.97 ± 1.29 5.16 ± 0.60 4.41 ± 0.29 bn130627372 1.58E-06 ± 2.41E-08 5.16 ± 1.38 4.22 ± 0.49 3.08 ± 0.27 bn130628531 8.87E-06 ± 6.04E-08 18.52 ± 1.32 17.33 ± 0.64 14.56 ± 0.32 bn130628860 1.03E-06 ± 9.79E-09 21.23 ± 1.55 8.26 ± 0.52 3.48 ± 0.21 bn130630272 1.65E-05 ± 6.95E-08 14.00 ± 2.04 11.05 ± 0.93 10.37 ± 0.46 bn130701060 7.12E-06 ± 9.84E-08 12.62 ± 2.23 11.52 ± 0.90 10.48 ± 0.45 bn130701761 4.92E-06 ± 2.64E-08 17.41 ± 1.26 11.88 ± 0.56 9.34 ± 0.25 bn130702004 5.72E-06 ± 1.21E-07 16.51 ± 4.69 12.66 ± 1.75 7.03 ± 0.86 bn130702951 7.53E-07 ± 3.98E-08 4.67 ± 1.78 2.24 ± 0.34 1.49 ± 0.17 bn130704560 2.43E-05 ± 5.42E-08 86.17 ± 2.85 75.86 ± 1.37 60.74 ± 0.65 bn130705398 2.12E-07 ± 2.34E-08 6.16 ± 1.01 3.51 ± 0.42 1.03 ± 0.17 bn130706900 1.86E-07 ± 2.12E-08 7.49 ± 0.98 3.57 ± 0.44 0.76 ± 0.17 bn130707505 1.05E-05 ± 1.07E-07 9.21 ± 2.60 6.75 ± 1.08 4.73 ± 0.47 bn130708488 2.53E-06 ± 2.70E-08 5.83 ± 1.20 4.51 ± 0.56 3.55 ± 0.24 bn130715906 4.11E-05 ± 1.70E-07 10.06 ± 1.29 8.31 ± 0.62 7.75 ± 0.31 bn130716352 2.99E-06 ± 5.63E-08 3.95 ± 1.33 1.98 ± 0.46 1.37 ± 0.21 bn130716442 6.40E-07 ± 8.86E-09 5.73 ± 0.90 4.66 ± 0.22 2.07 ± 0.17

– 173 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130717734 1.87E-06 ± 4.66E-08 2.95 ± 1.14 2.61 ± 0.45 1.81 ± 0.20 bn130720116 4.24E-06 ± 4.89E-08 4.19 ± 1.36 3.13 ± 0.37 2.55 ± 0.18 bn130720582 1.00E-04 ± 1.53E-07 29.52 ± 1.93 26.76 ± 0.95 24.93 ± 0.46 bn130722021 1.48E-06 ± 4.66E-08 3.46 ± 1.17 1.87 ± 0.36 1.17 ± 0.19 bn130722990 5.99E-07 ± 2.57E-08 7.11 ± 1.25 6.70 ± 0.62 5.48 ± 0.23 bn130723092 8.71E-07 ± 3.05E-08 6.39 ± 1.20 5.55 ± 0.56 4.43 ± 0.27 bn130725527 5.18E-06 ± 6.10E-08 14.93 ± 1.06 13.58 ± 0.55 9.87 ± 0.25 bn130727698 8.16E-06 ± 6.36E-08 15.90 ± 2.65 13.57 ± 1.18 11.13 ± 0.56 bn130730243 2.12E-06 ± 3.52E-08 5.27 ± 1.31 5.01 ± 0.62 3.96 ± 0.28 bn130802730 3.26E-07 ± 1.60E-08 8.86 ± 1.24 2.41 ± 0.42 0.66 ± 0.17 bn130803419 2.82E-06 ± 3.58E-08 9.65 ± 1.41 8.00 ± 0.66 7.07 ± 0.32 bn130804023 1.66E-06 ± 1.59E-08 40.68 ± 1.76 17.04 ± 0.67 7.44 ± 0.24 bn130808253 2.30E-07 ± 1.78E-08 20.76 ± 2.26 12.31 ± 0.96 3.58 ± 0.36 bn130811186 6.38E-06 ± 7.89E-08 6.50 ± 1.22 5.15 ± 0.57 4.31 ± 0.25 bn130813791 1.23E-06 ± 2.15E-08 6.38 ± 1.12 5.35 ± 0.49 3.17 ± 0.21 bn130815420 4.59E-05 ± 1.02E-07 10.74 ± 1.47 9.69 ± 0.75 7.98 ± 0.33 bn130815660 1.18E-05 ± 4.79E-08 34.53 ± 1.95 33.09 ± 0.93 30.67 ± 0.45 bn130816074 7.96E-07 ± 2.73E-08 3.20 ± 0.99 2.82 ± 0.30 1.95 ± 0.17 bn130818941 3.53E-06 ± 6.83E-08 9.94 ± 1.54 7.99 ± 0.64 6.25 ± 0.31 bn130819394 8.68E-06 ± 6.90E-08 5.53 ± 1.19 3.61 ± 0.48 2.63 ± 0.25 bn130821674 5.61E-05 ± 9.15E-08 44.11 ± 1.66 38.22 ± 0.80 27.87 ± 0.37 bn130828306 3.72E-05 ± 5.98E-08 8.37 ± 1.38 6.90 ± 0.61 5.41 ± 0.28 bn130828808 2.78E-06 ± 3.06E-08 10.94 ± 1.33 10.48 ± 0.63 8.89 ± 0.28 bn130829672 3.68E-06 ± 4.97E-08 13.77 ± 1.95 11.66 ± 0.91 10.31 ± 0.43 bn130830864 1.89E-06 ± 4.81E-08 3.34 ± 1.06 1.91 ± 0.45 1.40 ± 0.22 bn130830921 1.44E-06 ± 3.50E-08 4.91 ± 1.47 3.05 ± 0.64 2.27 ± 0.31 bn130831058 2.13E-06 ± 2.47E-08 3.69 ± 0.91 2.58 ± 0.41 2.05 ± 0.19 bn130903033 2.52E-06 ± 5.78E-08 3.95 ± 1.00 2.53 ± 0.33 1.34 ± 0.22 bn130905377 4.44E-06 ± 8.16E-08 4.99 ± 1.30 3.16 ± 0.38 2.60 ± 0.18 bn130906222 6.27E-07 ± 3.01E-08 3.68 ± 0.90 2.18 ± 0.44 1.68 ± 0.20 bn130906435 8.24E-07 ± 3.51E-08 3.30 ± 1.01 3.14 ± 0.43 2.10 ± 0.20 bn130907760 2.61E-07 ± 2.83E-08 3.37 ± 0.84 2.88 ± 0.41 1.84 ± 0.19

– 174 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130908677 2.92E-06 ± 1.51E-07 3.35 ± 1.24 1.72 ± 0.42 1.17 ± 0.21 bn130909817 1.98E-06 ± 5.84E-08 3.30 ± 1.11 1.99 ± 0.46 1.45 ± 0.21 bn130912358 7.01E-07 ± 1.77E-08 15.56 ± 1.47 10.48 ± 0.70 4.37 ± 0.28 bn130919173 3.68E-07 ± 1.11E-08 17.51 ± 1.40 10.36 ± 0.59 3.94 ± 0.24 bn130919352 4.68E-06 ± 3.62E-08 4.20 ± 0.94 2.90 ± 0.39 1.77 ± 0.19 bn130919985 3.36E-06 ± 1.46E-07 4.71 ± 1.20 2.72 ± 0.65 1.93 ± 0.32 bn130924255 3.73E-06 ± 6.19E-08 6.95 ± 1.74 5.41 ± 0.78 4.60 ± 0.35 bn130924910 3.47E-07 ± 3.95E-08 3.79 ± 1.14 3.15 ± 0.42 2.46 ± 0.21 bn130925164 6.34E-07 ± 2.75E-08 5.88 ± 1.66 3.69 ± 0.62 2.47 ± 0.27 bn130925173 8.48E-05 ± 2.62E-07 14.11 ± 1.55 12.34 ± 0.72 11.39 ± 0.31 bn130925546 1.49E-05 ± 2.20E-07 9.33 ± 2.37 7.20 ± 0.96 5.77 ± 0.52 bn130928537 1.95E-05 ± 9.76E-08 9.95 ± 2.88 6.17 ± 0.98 5.02 ± 0.47 bn130929375 3.23E-07 ± 1.40E-08 4.22 ± 1.44 1.84 ± 0.44 1.42 ± 0.22 bn131002288 1.20E-06 ± 5.53E-08 8.67 ± 2.52 7.13 ± 0.74 2.96 ± 0.37 bn131004904 5.10E-07 ± 1.91E-08 9.82 ± 1.71 9.82 ± 0.43 6.77 ± 0.29 bn131006367 1.27E-07 ± 1.48E-08 4.02 ± 0.96 2.15 ± 0.47 0.57 ± 0.20 bn131006840 1.84E-06 ± 5.57E-08 4.85 ± 1.37 2.91 ± 0.56 2.11 ± 0.26 bn131008858 8.23E-06 ± 7.02E-08 7.63 ± 1.98 6.16 ± 0.89 5.29 ± 0.42 bn131011741 8.88E-06 ± 6.44E-08 6.71 ± 1.28 5.04 ± 0.51 4.68 ± 0.26 bn131014215 1.98E-04 ± 1.50E-07 450.28 ± 5.39 428.88 ± 2.64 311.48 ± 1.13 bn131014513 1.95E-06 ± 4.64E-08 6.87 ± 1.68 4.87 ± 0.69 3.75 ± 0.29 bn131018673 2.73E-06 ± 1.17E-07 3.91 ± 1.29 2.29 ± 0.47 1.69 ± 0.22 bn131020113 2.76E-07 ± 2.54E-08 2.49 ± 0.79 1.79 ± 0.44 1.56 ± 0.21 bn131021352 1.40E-06 ± 4.62E-08 12.50 ± 1.81 11.42 ± 0.89 6.46 ± 0.39 bn131024900 1.33E-06 ± 4.32E-08 3.70 ± 0.87 2.45 ± 0.37 1.58 ± 0.18 bn131028076 1.53E-04 ± 1.31E-07 65.83 ± 2.86 64.04 ± 1.39 61.89 ± 0.70 bn131028096 1.46E-06 ± 6.20E-08 6.59 ± 1.72 5.45 ± 0.68 3.44 ± 0.29 bn131029973 2.90E-05 ± 1.23E-07 6.27 ± 1.07 5.36 ± 0.48 4.62 ± 0.22 bn131029990 4.49E-06 ± 9.29E-08 4.12 ± 0.99 2.44 ± 0.47 2.05 ± 0.20 bn131030653 1.65E-06 ± 3.20E-08 3.99 ± 0.91 2.93 ± 0.37 1.87 ± 0.19 bn131030791 3.51E-06 ± 3.28E-08 5.31 ± 1.09 4.00 ± 0.50 3.80 ± 0.24 bn131031482 4.38E-06 ± 5.03E-08 16.84 ± 1.23 13.37 ± 0.57 10.17 ± 0.27

– 175 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn131102622 1.42E-06 ± 4.64E-08 4.12 ± 1.20 1.87 ± 0.43 1.06 ± 0.20 bn131105087 2.38E-05 ± 1.11E-07 12.08 ± 1.18 10.06 ± 0.57 8.40 ± 0.28 bn131108024 2.82E-06 ± 4.70E-08 9.26 ± 1.34 8.40 ± 0.71 6.80 ± 0.35 bn131108862 3.57E-05 ± 1.34E-07 36.09 ± 1.56 27.27 ± 0.78 19.72 ± 0.36 bn131110373 3.27E-06 ± 3.29E-08 3.47 ± 1.03 2.95 ± 0.48 2.24 ± 0.23 bn131113483 2.30E-05 ± 9.54E-08 9.23 ± 1.30 7.79 ± 0.60 7.05 ± 0.29 bn131117766 1.44E-05 ± 7.80E-08 5.09 ± 1.17 3.24 ± 0.43 2.79 ± 0.21 bn131118958 6.75E-05 ± 4.03E-07 20.75 ± 4.80 16.01 ± 1.65 12.51 ± 0.93 bn131119781 1.85E-06 ± 2.45E-08 4.06 ± 0.81 3.31 ± 0.41 2.28 ± 0.20 bn131122490 2.83E-05 ± 7.37E-08 19.48 ± 1.86 18.24 ± 0.93 15.73 ± 0.46 bn131123543 4.08E-07 ± 2.74E-08 6.65 ± 1.16 4.62 ± 0.51 2.82 ± 0.23 bn131125689 4.52E-07 ± 2.94E-08 7.23 ± 1.77 5.93 ± 0.77 3.45 ± 0.37 bn131126163 1.70E-06 ± 2.83E-08 36.03 ± 2.11 18.70 ± 0.85 4.77 ± 0.27 bn131127480 4.24E-06 ± 5.36E-08 3.78 ± 0.92 2.80 ± 0.30 1.99 ± 0.20 bn131127592 3.85E-05 ± 1.44E-07 47.42 ± 2.12 46.54 ± 1.06 37.55 ± 0.49 bn131127696 1.22E-06 ± 7.52E-08 3.94 ± 0.89 3.30 ± 0.45 2.72 ± 0.21 bn131128629 5.70E-07 ± 4.11E-08 5.64 ± 1.23 4.75 ± 0.54 3.75 ± 0.26 bn131202633 8.17E-07 ± 5.26E-08 3.66 ± 1.13 2.67 ± 0.50 1.69 ± 0.23 bn131202906 1.24E-05 ± 4.39E-08 7.87 ± 1.44 5.64 ± 0.57 4.74 ± 0.31 bn131204937 1.65E-06 ± 2.41E-08 5.11 ± 1.09 3.61 ± 0.52 2.08 ± 0.22 bn131209547 1.37E-05 ± 8.83E-08 10.24 ± 1.21 9.01 ± 0.55 7.97 ± 0.27 bn131209963 6.57E-07 ± 7.38E-08 5.33 ± 1.35 4.45 ± 0.66 3.32 ± 0.30 bn131211510 4.51E-06 ± 4.65E-08 5.78 ± 1.14 4.76 ± 0.50 3.98 ± 0.16 bn131212814 4.75E-07 ± 4.98E-08 3.22 ± 0.96 2.16 ± 0.27 1.56 ± 0.20 bn131214705 7.22E-05 ± 2.12E-07 54.20 ± 3.07 54.20 ± 0.77 51.16 ± 0.39 bn131215298 8.05E-06 ± 9.03E-08 7.84 ± 1.42 6.42 ± 0.65 5.33 ± 0.31 bn131216081 6.78E-06 ± 3.99E-08 9.43 ± 1.04 8.44 ± 0.49 7.89 ± 0.23 bn131217108 6.76E-07 ± 3.86E-08 8.16 ± 1.25 5.58 ± 0.55 3.49 ± 0.26 bn131217183 5.75E-06 ± 7.99E-08 13.09 ± 3.55 10.26 ± 1.24 6.80 ± 0.37 bn131217506 5.75E-06 ± 7.99E-08 13.09 ± 3.55 10.26 ± 1.24 6.80 ± 0.37 bn131229277 2.64E-05 ± 6.67E-08 30.75 ± 1.63 28.43 ± 0.80 24.02 ± 0.38 bn131230529 5.91E-07 ± 3.98E-08 7.74 ± 2.53 3.52 ± 0.87 2.81 ± 0.40

– 176 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn131230808 4.11E-06 ± 4.28E-08 4.31 ± 1.11 3.24 ± 0.44 2.72 ± 0.21 bn131231198 1.52E-04 ± 1.19E-07 82.72 ± 2.68 82.12 ± 1.34 78.81 ± 0.65 bn140102887 1.78E-05 ± 2.41E-08 66.23 ± 1.96 59.14 ± 0.94 49.67 ± 0.43 bn140104731 3.33E-05 ± 6.02E-08 7.72 ± 1.22 6.56 ± 0.55 5.69 ± 0.19 bn140105065 6.43E-07 ± 1.38E-08 8.16 ± 1.19 5.91 ± 0.51 3.31 ± 0.23 bn140105748 1.30E-07 ± 2.19E-08 4.86 ± 1.08 3.51 ± 0.49 2.43 ± 0.24 bn140106345 2.46E-06 ± 8.36E-08 5.76 ± 2.14 3.26 ± 0.53 2.61 ± 0.30 bn140108721 1.97E-05 ± 2.48E-07 12.68 ± 1.56 11.55 ± 0.69 10.23 ± 0.32 bn140109771 1.89E-07 ± 4.28E-08 5.97 ± 1.73 3.78 ± 0.76 2.14 ± 0.40 bn140109877 1.49E-07 ± 2.50E-08 1.49 ± 1.10 0.82 ± 0.52 0.35 ± 0.22 bn140110263 5.43E-06 ± 4.53E-08 4.84 ± 0.95 4.10 ± 0.35 3.58 ± 0.18 bn140110411 4.60E-08 ± 5.51E-09 3.68 ± 1.19 1.62 ± 0.46 0.78 ± 0.21 bn140110814 8.32E-06 ± 1.31E-07 11.10 ± 3.54 7.26 ± 1.18 6.65 ± 0.58 bn140112060 1.60E-06 ± 4.38E-08 3.47 ± 0.99 2.79 ± 0.37 2.03 ± 0.18 bn140113183 2.65E-06 ± 4.49E-08 4.08 ± 1.15 3.53 ± 0.40 2.27 ± 0.22 bn140113624 5.70E-07 ± 3.86E-08 4.59 ± 1.16 4.36 ± 0.40 3.37 ± 0.20 bn140115863 3.95E-06 ± 3.76E-08 7.20 ± 1.12 6.52 ± 0.60 5.13 ± 0.29 bn140115899 3.26E-06 ± 5.44E-08 13.12 ± 1.97 12.58 ± 0.69 11.53 ± 0.36 bn140118064 3.96E-06 ± 4.60E-08 5.64 ± 1.31 4.42 ± 0.79 2.97 ± 0.28 bn140122597 9.05E-07 ± 5.27E-08 5.09 ± 1.53 3.33 ± 0.54 2.69 ± 0.24 bn140124527 2.01E-05 ± 1.42E-07 5.70 ± 1.08 4.95 ± 0.48 4.14 ± 0.23 bn140126815 5.35E-06 ± 4.04E-08 5.01 ± 1.21 3.71 ± 0.49 3.22 ± 0.24 bn140129499 2.24E-07 ± 1.53E-08 6.81 ± 1.35 5.11 ± 0.57 1.48 ± 0.25 bn140204547 2.35E-06 ± 3.69E-08 3.71 ± 0.92 2.20 ± 0.38 1.61 ± 0.19 bn140206275 1.23E-04 ± 2.78E-07 46.41 ± 1.57 45.59 ± 0.78 43.18 ± 0.39 bn140206304 1.55E-05 ± 7.48E-08 24.16 ± 2.13 22.96 ± 1.03 17.44 ± 0.48 bn140209313 8.97E-06 ± 5.33E-08 120.53 ± 3.44 106.73 ± 1.62 57.97 ± 0.65 bn140211091 7.37E-07 ± 3.19E-08 6.43 ± 1.33 5.42 ± 0.64 4.10 ± 0.27 bn140213807 2.12E-05 ± 6.54E-08 42.81 ± 2.08 41.32 ± 1.02 36.88 ± 0.49 bn140216331 9.74E-07 ± 1.10E-07 3.46 ± 1.04 2.84 ± 0.49 2.46 ± 0.23 bn140217043 2.34E-06 ± 3.69E-08 6.39 ± 1.31 4.84 ± 0.64 4.15 ± 0.30 bn140218427 5.61E-06 ± 6.19E-08 4.63 ± 1.25 3.75 ± 0.35 2.40 ± 0.26

– 177 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn140219319 2.69E-06 ± 2.70E-08 5.07 ± 0.90 4.01 ± 0.44 3.55 ± 0.21 bn140219824 2.84E-06 ± 4.25E-08 5.08 ± 1.17 4.51 ± 0.57 3.21 ± 0.26 bn140223495 1.98E-06 ± 3.35E-08 3.24 ± 1.05 2.76 ± 0.47 2.01 ± 0.20 bn140224382 6.58E-07 ± 4.26E-08 8.81 ± 1.35 6.65 ± 0.67 4.09 ± 0.30 bn140224788 2.42E-06 ± 6.28E-08 4.09 ± 1.11 3.27 ± 0.44 2.81 ± 0.23 bn140227738 7.14E-07 ± 8.18E-08 4.64 ± 1.28 3.04 ± 0.58 2.21 ± 0.27 bn140302342 5.96E-06 ± 4.45E-08 5.33 ± 1.05 4.53 ± 0.53 3.53 ± 0.27 bn140304557 2.43E-06 ± 3.16E-08 4.15 ± 0.80 3.29 ± 0.48 2.69 ± 0.22 bn140304849 8.32E-06 ± 5.24E-08 6.69 ± 1.50 5.52 ± 0.69 3.89 ± 0.32 bn140306146 5.78E-05 ± 8.89E-08 19.01 ± 1.33 14.14 ± 0.55 12.58 ± 0.25 bn140308710 6.44E-06 ± 3.86E-08 27.41 ± 1.77 23.51 ± 0.85 16.08 ± 0.39 bn140311453 3.70E-06 ± 5.40E-08 6.72 ± 1.47 4.94 ± 0.61 4.57 ± 0.30 bn140311618 3.97E-06 ± 1.24E-07 12.75 ± 1.51 11.70 ± 0.76 10.68 ± 0.37 bn140311885 7.02E-06 ± 6.75E-08 5.81 ± 1.55 4.05 ± 0.53 3.21 ± 0.28 bn140319964 7.13E-06 ± 3.46E-08 10.41 ± 1.33 9.23 ± 0.60 6.85 ± 0.28 bn140320092 1.02E-07 ± 9.71E-09 3.37 ± 1.01 2.15 ± 0.48 1.33 ± 0.23 bn140322424 2.01E-06 ± 2.77E-08 7.03 ± 1.15 6.14 ± 0.51 5.09 ± 0.27 bn140323433 3.24E-05 ± 1.92E-07 13.15 ± 1.21 11.14 ± 0.58 9.67 ± 0.28 bn140327065 8.79E-07 ± 4.22E-08 5.12 ± 1.24 3.13 ± 0.53 2.69 ± 0.24 bn140328560 7.47E-07 ± 1.25E-08 4.12 ± 0.92 2.97 ± 0.44 2.46 ± 0.21 bn140329272 2.38E-07 ± 8.46E-09 7.70 ± 0.98 3.87 ± 0.40 0.89 ± 0.17 bn140329295 6.59E-05 ± 3.63E-08 125.11 ± 3.82 113.24 ± 1.85 101.93 ± 0.88 bn140330180 5.69E-06 ± 8.72E-08 6.04 ± 1.08 4.86 ± 0.50 4.30 ± 0.24 bn140402007 2.84E-07 ± 2.90E-08 4.60 ± 0.74 3.81 ± 0.42 1.30 ± 0.17 bn140404030 1.92E-06 ± 6.21E-08 3.75 ± 1.13 2.87 ± 0.46 2.16 ± 0.22 bn140404171 8.18E-06 ± 2.33E-08 4.92 ± 1.00 3.97 ± 0.49 3.35 ± 0.21 bn140404900 4.55E-06 ± 3.86E-08 5.47 ± 1.16 4.39 ± 0.55 3.70 ± 0.25 bn140405033 2.60E-06 ± 3.30E-08 3.96 ± 1.18 3.13 ± 0.48 2.47 ± 0.23 bn140406120 1.15E-05 ± 1.09E-07 9.06 ± 1.51 7.44 ± 0.75 5.37 ± 0.33 bn140406144 2.35E-06 ± 8.74E-08 3.24 ± 0.92 1.96 ± 0.43 1.47 ± 0.21 bn140408553 6.57E-07 ± 5.42E-08 5.03 ± 1.54 3.11 ± 0.58 2.39 ± 0.25 bn140414693 5.99E-06 ± 4.48E-08 7.20 ± 1.11 5.82 ± 0.50 4.91 ± 0.25

– 178 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn140416060 8.14E-05 ± 3.87E-07 107.40 ± 5.56 101.47 ± 2.37 79.84 ± 1.21 bn140422194 4.78E-06 ± 1.08E-07 4.68 ± 1.33 3.02 ± 0.56 1.79 ± 0.23 bn140423356 1.81E-05 ± 1.22E-07 4.79 ± 0.94 3.72 ± 0.44 2.99 ± 0.20 bn140426515 2.28E-06 ± 3.17E-08 3.32 ± 1.19 2.29 ± 0.33 1.46 ± 0.16 bn140427702 5.37E-07 ± 6.43E-08 5.82 ± 1.87 3.86 ± 0.70 2.36 ± 0.37 bn140428906 9.19E-07 ± 2.01E-08 17.56 ± 1.99 10.43 ± 0.85 4.13 ± 0.37 bn140429975 6.20E-07 ± 1.99E-08 3.82 ± 1.17 2.08 ± 0.42 1.67 ± 0.21 bn140430716 9.18E-06 ± 1.55E-07 19.03 ± 2.51 16.68 ± 1.12 13.39 ± 0.51 bn140501139 2.07E-07 ± 1.93E-08 5.64 ± 1.28 3.54 ± 0.51 0.92 ± 0.20 bn140501497 6.97E-06 ± 4.38E-08 10.87 ± 1.75 8.88 ± 0.77 7.12 ± 0.36 bn140502354 2.11E-06 ± 3.55E-08 3.33 ± 1.05 2.41 ± 0.42 1.63 ± 0.19 bn140506880 6.59E-06 ± 1.18E-07 24.80 ± 2.94 21.50 ± 1.46 15.67 ± 0.70 bn140508128 6.14E-05 ± 1.21E-07 88.15 ± 4.32 85.67 ± 2.14 66.81 ± 0.96 bn140508179 3.34E-06 ± 8.33E-08 7.57 ± 2.59 3.98 ± 0.93 3.25 ± 0.50 bn140508629 2.61E-06 ± 4.59E-08 3.13 ± 0.81 2.16 ± 0.27 1.69 ± 0.14 bn140511095 3.71E-07 ± 3.21E-08 9.40 ± 1.03 7.49 ± 0.54 3.03 ± 0.18 bn140511995 6.75E-06 ± 4.15E-08 5.38 ± 1.19 4.12 ± 0.58 3.39 ± 0.26 bn140512814 2.93E-05 ± 8.14E-08 15.27 ± 1.25 13.78 ± 0.56 10.96 ± 0.27 bn140513724 4.11E-06 ± 6.23E-08 7.70 ± 1.17 6.93 ± 0.57 6.18 ± 0.27 bn140516700 2.64E-06 ± 2.91E-08 3.46 ± 0.91 2.50 ± 0.39 1.89 ± 0.20 bn140516765 6.61E-06 ± 1.18E-07 8.87 ± 1.30 7.58 ± 0.65 6.38 ± 0.33 bn140517813 4.73E-06 ± 3.95E-08 5.27 ± 0.94 4.19 ± 0.50 3.61 ± 0.24 bn140518709 3.81E-07 ± 2.68E-08 5.37 ± 1.15 3.70 ± 0.70 2.45 ± 0.35 bn140519043 3.92E-06 ± 4.55E-08 4.12 ± 1.35 3.73 ± 0.51 2.71 ± 0.23 bn140521184 2.75E-06 ± 3.85E-08 4.02 ± 0.98 2.85 ± 0.47 2.03 ± 0.21 bn140521732 2.68E-06 ± 4.19E-08 6.26 ± 1.12 4.72 ± 0.48 3.90 ± 0.22 bn140523129 5.12E-05 ± 4.49E-08 53.53 ± 1.94 46.72 ± 0.97 38.41 ± 0.48 bn140526449 6.79E-06 ± 4.07E-08 16.90 ± 1.61 4.30 ± 0.50 2.86 ± 0.25 bn140526571 1.58E-07 ± 1.28E-08 4.06 ± 0.90 2.60 ± 0.40 0.59 ± 0.17 bn140528837 2.15E-05 ± 4.82E-08 20.20 ± 1.64 16.37 ± 0.75 13.61 ± 0.36 bn140603476 1.86E-05 ± 2.16E-07 5.47 ± 1.12 4.72 ± 0.54 3.65 ± 0.25 bn140605377 8.03E-07 ± 8.51E-09 11.24 ± 0.89 7.40 ± 0.41 2.33 ± 0.15

– 179 –

Table 7—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn140606133 7.59E-06 ± 4.47E-08 16.26 ± 1.35 14.70 ± 0.68 13.18 ± 0.33 bn140608153 1.23E-05 ± 2.25E-07 12.18 ± 3.86 6.94 ± 1.15 5.42 ± 0.65 bn140608713 1.95E-06 ± 6.00E-08 9.97 ± 2.09 9.26 ± 1.00 7.50 ± 0.51 bn140610487 2.64E-07 ± 2.77E-08 4.73 ± 0.98 4.00 ± 0.49 1.68 ± 0.21 bn140610548 1.84E-05 ± 5.62E-08 12.27 ± 1.34 9.98 ± 0.66 9.36 ± 0.32 bn140610689 1.38E-05 ± 1.24E-07 6.63 ± 1.95 3.63 ± 0.70 2.54 ± 0.34 bn140612294 4.10E-06 ± 8.92E-08 4.71 ± 0.88 3.30 ± 0.42 2.71 ± 0.20 bn140616165 2.81E-07 ± 3.35E-08 9.35 ± 1.54 6.58 ± 0.59 2.48 ± 0.21 bn140619475 1.55E-06 ± 6.95E-08 5.28 ± 0.75 4.64 ± 0.36 3.19 ± 0.18 bn140619490 2.10E-07 ± 4.38E-08 16.01 ± 2.61 5.86 ± 0.91 2.00 ± 0.43 bn140620219 6.15E-06 ± 6.40E-08 9.13 ± 1.69 6.79 ± 0.77 6.32 ± 0.36 bn140621827 6.06E-06 ± 5.05E-08 31.70 ± 1.94 16.28 ± 0.79 8.27 ± 0.31 bn140623224 3.22E-06 ± 4.78E-08 3.92 ± 1.18 2.74 ± 0.48 1.79 ± 0.20 bn140624423 2.42E-07 ± 9.53E-09 19.15 ± 1.29 5.96 ± 0.45 1.52 ± 0.17 bn140626843 9.93E-07 ± 3.78E-08 10.06 ± 2.12 8.45 ± 0.88 7.12 ± 0.41 bn140627401 9.00E-07 ± 5.98E-08 5.60 ± 1.35 4.14 ± 0.29 2.98 ± 0.25 bn140628626 1.47E-06 ± 6.23E-08 4.37 ± 1.25 3.63 ± 0.42 2.41 ± 0.24 bn140628704 1.82E-06 ± 9.89E-08 6.09 ± 1.75 4.21 ± 0.40 2.64 ± 0.34 bn140630505 7.63E-06 ± 7.69E-08 4.51 ± 1.17 3.13 ± 0.51 2.42 ± 0.21 bn140701567 2.65E-06 ± 3.93E-08 3.83 ± 1.26 2.76 ± 0.51 2.04 ± 0.22 bn140701833 2.61E-06 ± 5.18E-08 17.41 ± 1.62 14.34 ± 0.78 9.17 ± 0.36 bn140703026 7.57E-06 ± 5.09E-08 5.59 ± 0.98 4.44 ± 0.46 4.05 ± 0.23 bn140705539 3.18E-06 ± 4.82E-08 3.66 ± 0.92 2.95 ± 0.44 2.67 ± 0.21 bn140706815 2.49E-06 ± 7.80E-08 4.84 ± 1.13 3.91 ± 0.53 2.95 ± 0.26 bn140709051 7.35E-06 ± 1.85E-07 7.67 ± 1.62 6.16 ± 0.74 5.24 ± 0.34 bn140709637 7.36E-06 ± 6.34E-08 3.22 ± 0.92 2.70 ± 0.41 2.12 ± 0.18 bn140710537 3.83E-07 ± 7.14E-09 7.64 ± 1.50 4.33 ± 0.57 1.51 ± 0.23 bn140710901 1.40E-06 ± 4.77E-08 5.16 ± 1.20 3.72 ± 0.62 2.45 ± 0.27 bn140711691 2.39E-06 ± 1.13E-07 4.44 ± 1.28 2.50 ± 0.54 1.33 ± 0.26

– 180 –

– 181 –

Table 8. GRB Fluence & Peak Flux (50–300 keV)

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn080714086 3.54E-07 ± 1.73E-08 1.52 ± 0.74 0.91 ± 0.36 0.43 ± 0.18 bn080714425 9.79E-07 ± 1.36E-08 1.03 ± 0.45 0.71 ± 0.19 0.46 ± 0.08 bn080714745 3.26E-06 ± 6.03E-08 4.41 ± 1.66 3.27 ± 0.71 2.82 ± 0.36 bn080715950 2.54E-06 ± 3.52E-08 10.70 ± 0.95 6.61 ± 0.45 3.83 ± 0.22 bn080717543 2.37E-06 ± 4.51E-08 2.14 ± 1.03 1.30 ± 0.47 1.05 ± 0.23 bn080719529 3.88E-07 ± 1.47E-08 0.59 ± 0.18 0.32 ± 0.08 0.23 ± 0.04 bn080720316 3.88E-07 ± 1.47E-08 0.59 ± 0.18 0.32 ± 0.08 0.23 ± 0.04 bn080723557 3.92E-05 ± 1.15E-07 21.19 ± 1.79 19.81 ± 1.09 15.14 ± 0.48 bn080723913 7.45E-08 ± 5.19E-09 2.62 ± 0.66 2.14 ± 0.32 0.69 ± 0.13 bn080723985 1.57E-05 ± 1.07E-07 5.92 ± 1.23 5.17 ± 0.54 4.85 ± 0.28 bn080724401 8.65E-06 ± 2.51E-08 10.71 ± 0.66 8.75 ± 0.30 4.76 ± 0.12 bn080725435 4.18E-06 ± 2.29E-08 2.48 ± 0.77 1.64 ± 0.32 1.38 ± 0.17 bn080725541 2.57E-07 ± 2.20E-08 2.99 ± 0.78 2.32 ± 0.36 0.92 ± 0.13 bn080727964 6.45E-06 ± 4.22E-08 2.65 ± 0.48 2.17 ± 0.33 1.71 ± 0.17 bn080730520 3.00E-06 ± 5.87E-08 3.70 ± 0.75 2.81 ± 0.41 2.48 ± 0.21 bn080730786 3.96E-06 ± 4.39E-08 8.75 ± 0.90 8.50 ± 0.45 7.06 ± 0.22 bn080802386 2.54E-07 ± 3.46E-09 6.33 ± 1.12 3.48 ± 0.50 1.38 ± 0.22 bn080803772 2.66E-06 ± 3.19E-08 1.86 ± 0.35 1.38 ± 0.29 1.11 ± 0.11 bn080804456 4.42E-06 ± 4.99E-08 1.62 ± 0.60 0.96 ± 0.27 0.76 ± 0.14 bn080804972 5.29E-06 ± 5.50E-08 2.52 ± 0.68 2.08 ± 0.37 1.85 ± 0.16 bn080805496 6.82E-07 ± 2.22E-08 1.10 ± 0.37 0.78 ± 0.17 0.47 ± 0.07 bn080805584 2.27E-06 ± 3.37E-08 1.66 ± 0.78 0.76 ± 0.32 0.51 ± 0.18 bn080806584 2.38E-07 ± 1.13E-08 1.19 ± 0.62 1.08 ± 0.32 0.75 ± 0.16 bn080806896 6.16E-06 ± 1.01E-07 3.83 ± 0.85 3.51 ± 0.42 2.72 ± 0.21 bn080807993 2.75E-06 ± 2.96E-08 9.23 ± 0.82 7.14 ± 0.39 4.12 ± 0.18 bn080808451 4.11E-07 ± 2.18E-08 1.21 ± 0.45 0.91 ± 0.23 0.72 ± 0.14 bn080808565 2.13E-06 ± 2.22E-08 2.45 ± 0.74 1.83 ± 0.44 1.67 ± 0.20 bn080808772 3.87E-06 ± 4.05E-08 1.41 ± 0.69 0.74 ± 0.35 0.45 ± 0.17 bn080809808 2.06E-06 ± 2.34E-08 2.59 ± 1.19 1.96 ± 0.58 1.23 ± 0.26 bn080810549 6.03E-06 ± 2.43E-08 2.56 ± 0.52 2.10 ± 0.23 1.36 ± 0.09 bn080812889 1.57E-06 ± 1.92E-08 1.68 ± 0.71 1.27 ± 0.37 0.82 ± 0.18 bn080815917 2.78E-07 ± 1.50E-08 2.62 ± 0.88 2.09 ± 0.46 1.40 ± 0.20

– 182 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn080816503 8.23E-06 ± 5.04E-08 5.64 ± 0.71 4.38 ± 0.35 3.06 ± 0.18 bn080816989 8.14E-07 ± 2.50E-08 4.11 ± 0.62 3.22 ± 0.29 2.25 ± 0.13 bn080817161 2.56E-05 ± 3.50E-08 8.14 ± 1.04 6.94 ± 0.52 6.65 ± 0.24 bn080817720 5.51E-07 ± 1.13E-08 4.17 ± 0.92 2.02 ± 0.53 1.38 ± 0.21 bn080818579 2.10E-06 ± 3.33E-08 3.71 ± 0.77 3.03 ± 0.40 2.14 ± 0.19 bn080818945 8.43E-07 ± 1.07E-08 2.41 ± 0.73 1.60 ± 0.43 1.20 ± 0.19 bn080821332 2.20E-06 ± 1.07E-08 5.49 ± 1.03 4.80 ± 0.59 4.31 ± 0.27 bn080823363 3.19E-06 ± 2.20E-08 2.23 ± 0.79 1.72 ± 0.46 1.39 ± 0.21 bn080824909 1.58E-06 ± 3.47E-08 5.94 ± 0.96 5.14 ± 0.52 2.93 ± 0.23 bn080825593 2.05E-05 ± 5.81E-08 16.65 ± 1.09 15.29 ± 0.60 12.66 ± 0.27 bn080828189 3.05E-07 ± 1.10E-08 2.12 ± 0.53 1.86 ± 0.29 0.76 ± 0.12 bn080829790 1.36E-06 ± 1.33E-08 2.77 ± 0.99 2.12 ± 0.54 1.71 ± 0.24 bn080830368 3.83E-06 ± 6.16E-08 2.99 ± 0.73 2.57 ± 0.38 2.29 ± 0.18 bn080831053 3.91E-08 ± 9.59E-09 2.68 ± 0.58 0.51 ± 0.22 0.15 ± 0.10 bn080831921 5.09E-06 ± 2.44E-08 2.24 ± 0.93 1.46 ± 0.49 1.24 ± 0.21 bn080904886 2.13E-06 ± 3.72E-08 3.79 ± 1.23 3.63 ± 0.57 2.92 ± 0.28 bn080905499 3.17E-07 ± 1.25E-08 4.55 ± 0.57 3.09 ± 0.31 1.31 ± 0.14 bn080905570 2.27E-06 ± 3.05E-08 1.81 ± 1.22 1.55 ± 0.57 1.19 ± 0.27 bn080905705 1.61E-06 ± 2.07E-08 1.13 ± 0.42 0.79 ± 0.16 0.58 ± 0.07 bn080906212 3.86E-06 ± 7.35E-08 13.02 ± 0.75 12.23 ± 0.37 10.19 ± 0.17 bn080912360 1.10E-06 ± 1.67E-08 1.23 ± 0.58 0.94 ± 0.29 0.78 ± 0.15 bn080913735 2.12E-06 ± 4.71E-08 2.70 ± 0.81 1.92 ± 0.40 1.32 ± 0.18 bn080916009 2.75E-05 ± 3.80E-08 7.32 ± 0.69 6.92 ± 0.33 6.28 ± 0.16 bn080916406 4.73E-06 ± 4.63E-08 4.20 ± 0.67 2.74 ± 0.30 2.08 ± 0.13 bn080919790 2.36E-08 ± 2.95E-09 0.99 ± 0.30 0.57 ± 0.12 0.15 ± 0.05 bn080920268 9.41E-07 ± 2.87E-08 1.19 ± 0.57 0.68 ± 0.24 0.50 ± 0.11 bn080924766 2.52E-06 ± 3.56E-08 2.29 ± 0.69 1.96 ± 0.36 1.61 ± 0.17 bn080925775 1.02E-05 ± 2.27E-08 8.58 ± 0.91 7.70 ± 0.46 6.90 ± 0.23 bn080927480 1.67E-06 ± 5.31E-08 1.44 ± 0.44 1.01 ± 0.22 0.64 ± 0.08 bn080928628 5.97E-07 ± 1.61E-08 1.69 ± 0.31 1.30 ± 0.16 0.83 ± 0.07 bn081003644 3.49E-06 ± 3.79E-08 2.56 ± 0.98 2.07 ± 0.46 1.03 ± 0.22 bn081006604 3.77E-07 ± 9.95E-09 3.06 ± 0.62 1.41 ± 0.30 0.47 ± 0.07

– 183 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn081006872 2.39E-07 ± 1.10E-08 1.99 ± 0.50 0.99 ± 0.17 0.45 ± 0.07 bn081008832 4.73E-06 ± 6.06E-08 1.73 ± 0.79 1.13 ± 0.30 0.92 ± 0.15 bn081009140 1.40E-05 ± 1.63E-08 39.93 ± 2.49 36.75 ± 1.23 30.43 ± 0.61 bn081009690 6.21E-06 ± 4.08E-08 3.98 ± 1.09 3.22 ± 0.46 2.83 ± 0.22 bn081012045 1.33E-07 ± 2.43E-08 1.82 ± 0.37 1.31 ± 0.15 0.89 ± 0.07 bn081012549 1.80E-06 ± 4.24E-08 1.45 ± 0.69 1.02 ± 0.31 0.90 ± 0.13 bn081017474 7.33E-07 ± 1.15E-08 1.78 ± 0.45 0.91 ± 0.17 0.69 ± 0.08 bn081021398 3.62E-06 ± 5.75E-08 2.86 ± 1.07 2.24 ± 0.47 1.81 ± 0.23 bn081022364 7.17E-07 ± 1.88E-08 1.41 ± 0.38 0.99 ± 0.19 0.79 ± 0.09 bn081024245 7.88E-08 ± 9.11E-09 3.78 ± 0.81 1.50 ± 0.24 0.57 ± 0.09 bn081024851 3.44E-06 ± 3.78E-08 1.82 ± 0.73 1.02 ± 0.37 0.70 ± 0.18 bn081024891 2.07E-07 ± 1.41E-08 3.60 ± 0.56 1.93 ± 0.26 1.07 ± 0.14 bn081025349 3.32E-06 ± 5.82E-08 2.98 ± 0.68 2.60 ± 0.36 2.14 ± 0.17 bn081028538 1.28E-06 ± 1.52E-08 3.14 ± 0.85 2.63 ± 0.43 2.01 ± 0.21 bn081101167 7.26E-07 ± 3.24E-08 1.73 ± 0.53 0.92 ± 0.26 0.58 ± 0.12 bn081101491 8.60E-08 ± 1.50E-09 3.32 ± 0.80 1.75 ± 0.37 0.43 ± 0.15 bn081101532 6.81E-06 ± 1.39E-07 6.24 ± 1.39 5.64 ± 0.64 4.96 ± 0.31 bn081102365 5.21E-07 ± 1.81E-08 2.91 ± 0.57 2.27 ± 0.29 1.38 ± 0.14 bn081102739 2.28E-06 ± 5.56E-08 1.83 ± 0.76 1.34 ± 0.40 0.92 ± 0.17 bn081105614 8.46E-08 ± 8.58E-09 3.50 ± 0.69 1.21 ± 0.24 0.32 ± 0.09 bn081107321 6.78E-07 ± 1.59E-08 5.08 ± 0.79 4.39 ± 0.40 3.05 ± 0.19 bn081109293 3.39E-06 ± 2.80E-08 1.70 ± 0.70 1.07 ± 0.40 0.79 ± 0.19 bn081110601 3.06E-06 ± 4.74E-08 11.00 ± 1.02 9.31 ± 0.57 7.13 ± 0.27 bn081113230 1.75E-07 ± 1.85E-08 3.96 ± 0.99 2.78 ± 0.47 1.15 ± 0.18 bn081115891 4.63E-08 ± 6.74E-09 2.70 ± 0.50 0.97 ± 0.15 0.35 ± 0.05 bn081118876 2.71E-06 ± 1.99E-08 3.41 ± 0.77 2.59 ± 0.37 2.32 ± 0.18 bn081119184 6.14E-08 ± 9.29E-09 2.43 ± 0.65 1.11 ± 0.22 0.42 ± 0.08 bn081120618 8.64E-07 ± 1.04E-08 1.67 ± 0.45 1.38 ± 0.22 1.20 ± 0.11 bn081121858 8.47E-06 ± 1.20E-07 7.16 ± 1.25 5.69 ± 0.75 3.50 ± 0.37 bn081122520 4.61E-06 ± 4.46E-08 9.44 ± 1.05 8.97 ± 0.52 6.09 ± 0.24 bn081122614 7.05E-08 ± 4.38E-09 3.62 ± 0.51 1.86 ± 0.19 0.45 ± 0.06 bn081124060 2.07E-06 ± 2.86E-08 2.17 ± 1.15 2.14 ± 0.55 1.74 ± 0.30

– 184 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn081125496 1.10E-05 ± 8.32E-08 14.90 ± 1.83 14.47 ± 0.90 12.76 ± 0.43 bn081126899 5.37E-06 ± 3.22E-08 4.28 ± 0.81 3.72 ± 0.39 3.34 ± 0.19 bn081129161 8.46E-06 ± 7.31E-08 9.78 ± 1.26 9.09 ± 0.64 6.91 ± 0.31 bn081130212 9.50E-08 ± 1.20E-08 1.22 ± 0.47 0.86 ± 0.20 0.41 ± 0.08 bn081130629 1.84E-06 ± 2.98E-08 2.72 ± 0.80 1.94 ± 0.37 1.72 ± 0.19 bn081204004 7.08E-07 ± 3.46E-08 2.77 ± 0.66 2.05 ± 0.30 1.45 ± 0.15 bn081204517 1.75E-07 ± 8.22E-09 6.45 ± 0.83 3.26 ± 0.36 0.93 ± 0.13 bn081206275 2.52E-06 ± 4.39E-08 2.01 ± 0.80 1.30 ± 0.41 0.89 ± 0.16 bn081206604 2.62E-07 ± 1.86E-08 0.66 ± 0.24 0.54 ± 0.12 0.45 ± 0.06 bn081206987 6.49E-07 ± 1.77E-08 0.85 ± 0.41 0.60 ± 0.14 0.41 ± 0.06 bn081207680 2.61E-05 ± 5.93E-08 3.34 ± 0.73 2.74 ± 0.34 2.41 ± 0.17 bn081209981 4.17E-07 ± 6.89E-09 11.82 ± 1.21 6.88 ± 0.54 1.82 ± 0.22 bn081213173 5.63E-08 ± 9.37E-09 2.96 ± 0.58 1.19 ± 0.20 0.36 ± 0.06 bn081215784 2.32E-05 ± 2.51E-08 70.61 ± 2.13 57.89 ± 1.00 31.29 ± 0.39 bn081215880 1.04E-06 ± 1.66E-08 3.08 ± 0.74 2.33 ± 0.34 1.33 ± 0.13 bn081216531 9.46E-07 ± 3.24E-08 16.66 ± 1.27 13.12 ± 0.57 4.17 ± 0.21 bn081217983 5.29E-06 ± 7.06E-08 3.50 ± 0.64 2.98 ± 0.30 2.67 ± 0.16 bn081221681 1.78E-05 ± 3.72E-08 12.01 ± 1.36 11.38 ± 0.64 11.06 ± 0.32 bn081222204 6.94E-06 ± 5.26E-08 6.63 ± 0.93 5.93 ± 0.45 5.30 ± 0.23 bn081223419 5.04E-07 ± 9.49E-09 7.70 ± 0.88 6.76 ± 0.42 2.68 ± 0.18 bn081224887 1.69E-05 ± 7.74E-08 13.46 ± 1.08 13.18 ± 0.55 12.85 ± 0.27 bn081225257 2.35E-06 ± 3.02E-08 1.30 ± 0.63 0.76 ± 0.29 0.64 ± 0.14 bn081226044 2.07E-07 ± 1.46E-08 3.32 ± 0.83 2.97 ± 0.39 1.04 ± 0.13 bn081226156 1.60E-06 ± 7.59E-09 1.45 ± 0.59 0.91 ± 0.37 0.75 ± 0.19 bn081226509 1.93E-07 ± 7.25E-09 5.13 ± 0.78 3.46 ± 0.33 0.95 ± 0.13 bn081229187 2.81E-07 ± 3.55E-08 2.66 ± 0.60 2.27 ± 0.33 0.75 ± 0.16 bn081229675 2.81E-07 ± 3.55E-08 2.66 ± 0.60 2.27 ± 0.33 0.75 ± 0.16 bn081230871 9.14E-08 ± 7.74E-09 2.37 ± 0.62 0.98 ± 0.30 0.51 ± 0.15 bn081231140 9.08E-06 ± 6.37E-08 7.30 ± 1.05 6.62 ± 0.50 4.96 ± 0.23 bn090101758 6.96E-06 ± 6.05E-08 6.44 ± 0.95 5.52 ± 0.55 4.84 ± 0.28 bn090102122 1.30E-05 ± 3.02E-08 10.01 ± 0.97 8.50 ± 0.47 6.45 ± 0.21 bn090107681 1.71E-06 ± 5.67E-08 2.37 ± 1.63 1.62 ± 0.69 0.97 ± 0.33

– 185 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090108020 5.17E-07 ± 9.23E-09 13.13 ± 0.75 8.97 ± 0.32 3.09 ± 0.11 bn090108322 1.83E-07 ± 7.72E-09 4.65 ± 0.68 3.46 ± 0.29 0.90 ± 0.09 bn090109332 1.07E-07 ± 9.15E-09 1.94 ± 0.82 1.00 ± 0.47 0.48 ± 0.22 bn090112332 2.15E-06 ± 3.66E-08 3.44 ± 0.60 2.78 ± 0.27 1.84 ± 0.11 bn090112729 5.54E-06 ± 5.44E-08 7.42 ± 1.32 7.13 ± 0.63 5.86 ± 0.29 bn090113778 8.27E-07 ± 2.60E-08 3.61 ± 0.71 2.56 ± 0.36 1.69 ± 0.17 bn090117335 6.96E-07 ± 2.37E-08 1.97 ± 0.50 1.55 ± 0.23 1.24 ± 0.11 bn090117632 6.00E-06 ± 8.74E-08 2.39 ± 0.62 1.72 ± 0.35 1.44 ± 0.17 bn090117640 9.85E-07 ± 2.16E-08 2.82 ± 0.98 2.68 ± 0.49 1.74 ± 0.21 bn090120627 3.82E-07 ± 1.07E-08 2.54 ± 0.63 1.66 ± 0.30 0.93 ± 0.15 bn090126227 4.92E-07 ± 9.30E-09 1.47 ± 0.67 0.93 ± 0.37 0.77 ± 0.18 bn090126245 2.02E-07 ± 1.06E-08 2.41 ± 0.48 1.39 ± 0.23 0.86 ± 0.11 bn090129880 2.70E-06 ± 2.81E-08 3.92 ± 0.77 2.88 ± 0.43 2.66 ± 0.21 bn090131090 8.64E-06 ± 2.82E-08 13.77 ± 1.52 12.75 ± 0.74 9.21 ± 0.35 bn090202347 2.93E-06 ± 1.37E-08 4.00 ± 0.77 3.49 ± 0.40 2.74 ± 0.20 bn090206620 2.61E-07 ± 6.55E-09 6.58 ± 0.73 4.33 ± 0.31 1.21 ± 0.09 bn090207777 1.43E-06 ± 2.25E-08 1.86 ± 0.40 1.37 ± 0.18 0.91 ± 0.07 bn090213236 6.61E-07 ± 3.28E-08 1.33 ± 0.43 0.84 ± 0.20 0.47 ± 0.10 bn090217206 1.14E-05 ± 1.79E-08 6.91 ± 0.69 5.52 ± 0.32 4.51 ± 0.14 bn090219074 9.30E-08 ± 2.58E-08 2.78 ± 0.97 1.58 ± 0.40 0.68 ± 0.15 bn090222179 1.93E-06 ± 3.04E-08 2.16 ± 0.70 1.67 ± 0.33 1.29 ± 0.17 bn090225009 7.22E-08 ± 8.10E-09 1.05 ± 0.68 0.64 ± 0.13 0.29 ± 0.07 bn090227310 1.50E-06 ± 1.17E-08 3.91 ± 0.61 1.75 ± 0.20 1.25 ± 0.09 bn090227772 1.86E-06 ± 2.34E-08 38.97 ± 4.66 25.90 ± 1.27 7.30 ± 0.33 bn090228204 1.76E-06 ± 1.32E-08 60.99 ± 2.19 25.46 ± 0.70 7.22 ± 0.19 bn090228976 5.42E-07 ± 3.88E-08 1.14 ± 0.38 0.83 ± 0.15 0.60 ± 0.08 bn090301315 1.14E-06 ± 1.62E-08 2.06 ± 0.63 1.58 ± 0.35 1.34 ± 0.18 bn090304216 4.80E-07 ± 5.26E-08 1.80 ± 0.52 1.28 ± 0.36 0.84 ± 0.14 bn090305052 7.73E-07 ± 6.47E-09 4.89 ± 0.51 4.08 ± 0.28 2.68 ± 0.15 bn090306245 7.13E-07 ± 1.93E-08 1.27 ± 0.35 0.67 ± 0.15 0.41 ± 0.06 bn090307167 5.54E-07 ± 2.03E-08 0.81 ± 0.26 0.46 ± 0.17 0.32 ± 0.06 bn090308734 1.01E-06 ± 1.36E-08 6.20 ± 0.71 4.78 ± 0.34 3.04 ± 0.17

– 186 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090309767 2.28E-06 ± 3.76E-08 2.00 ± 0.74 1.30 ± 0.43 1.00 ± 0.19 bn090310189 3.00E-06 ± 3.28E-08 2.90 ± 0.80 1.83 ± 0.40 1.39 ± 0.20 bn090316311 5.72E-07 ± 1.09E-08 4.25 ± 0.52 3.05 ± 0.29 1.17 ± 0.11 bn090319622 3.49E-06 ± 3.38E-08 2.12 ± 0.49 1.39 ± 0.18 0.99 ± 0.09 bn090320045 2.49E-07 ± 1.15E-08 0.93 ± 0.58 0.80 ± 0.25 0.55 ± 0.13 bn090320418 4.96E-07 ± 1.77E-08 1.49 ± 0.49 1.05 ± 0.31 0.74 ± 0.14 bn090320801 8.84E-07 ± 3.26E-08 2.00 ± 0.47 1.50 ± 0.21 0.99 ± 0.10 bn090323002 5.32E-05 ± 8.35E-08 8.41 ± 0.81 7.31 ± 0.40 6.24 ± 0.20 bn090326633 8.79E-07 ± 3.09E-08 1.90 ± 0.82 1.54 ± 0.45 1.27 ± 0.22 bn090327404 1.57E-06 ± 2.92E-08 1.65 ± 0.70 1.20 ± 0.31 0.98 ± 0.17 bn090328401 1.97E-05 ± 3.81E-08 11.90 ± 0.84 11.06 ± 0.41 8.30 ± 0.18 bn090328713 7.15E-08 ± 1.02E-08 5.80 ± 0.55 2.53 ± 0.20 0.61 ± 0.06 bn090330279 6.53E-06 ± 2.23E-08 3.22 ± 0.74 2.91 ± 0.35 2.23 ± 0.18 bn090331681 1.73E-07 ± 1.74E-08 3.98 ± 0.82 1.93 ± 0.35 1.00 ± 0.16 bn090403314 6.33E-07 ± 1.07E-08 1.41 ± 0.40 0.77 ± 0.13 0.49 ± 0.06 bn090405663 1.43E-07 ± 1.56E-08 4.00 ± 0.53 2.35 ± 0.23 0.71 ± 0.10 bn090409288 5.68E-07 ± 3.07E-08 1.12 ± 0.75 0.95 ± 0.38 0.44 ± 0.18 bn090411838 3.80E-06 ± 6.37E-08 4.45 ± 0.88 3.65 ± 0.49 2.65 ± 0.22 bn090411991 3.59E-06 ± 5.61E-08 3.84 ± 0.96 3.02 ± 0.50 2.04 ± 0.25 bn090412061 7.36E-08 ± 7.83E-09 2.37 ± 0.57 1.70 ± 0.24 0.45 ± 0.10 bn090413122 1.97E-06 ± 2.71E-08 2.50 ± 0.67 2.06 ± 0.33 1.32 ± 0.16 bn090418816 9.99E-08 ± 1.72E-08 3.10 ± 0.56 1.85 ± 0.25 0.74 ± 0.11 bn090419997 5.65E-06 ± 1.15E-07 1.79 ± 0.59 1.38 ± 0.29 1.24 ± 0.16 bn090422150 2.67E-07 ± 1.84E-08 1.71 ± 0.43 1.47 ± 0.22 0.80 ± 0.10 bn090423330 4.36E-07 ± 4.05E-08 1.26 ± 0.47 0.79 ± 0.20 0.58 ± 0.10 bn090424592 2.80E-05 ± 2.02E-08 64.98 ± 1.88 58.04 ± 0.99 45.97 ± 0.49 bn090425377 8.04E-06 ± 6.66E-08 6.71 ± 1.79 5.62 ± 0.79 4.64 ± 0.39 bn090426066 3.75E-07 ± 2.04E-08 1.40 ± 0.33 1.00 ± 0.16 0.78 ± 0.08 bn090426690 1.41E-06 ± 3.04E-08 3.03 ± 0.78 2.71 ± 0.41 2.29 ± 0.19 bn090427644 1.52E-07 ± 9.99E-09 1.42 ± 0.60 1.08 ± 0.29 0.76 ± 0.15 bn090427688 9.36E-07 ± 1.58E-08 1.75 ± 0.48 0.91 ± 0.20 0.63 ± 0.08 bn090428441 6.16E-07 ± 3.67E-08 5.08 ± 0.90 3.92 ± 0.50 2.26 ± 0.25

– 187 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090428552 2.80E-06 ± 6.16E-08 2.51 ± 0.96 2.09 ± 0.53 1.76 ± 0.27 bn090429530 1.67E-06 ± 5.07E-08 2.37 ± 1.16 1.59 ± 0.46 1.24 ± 0.22 bn090429753 3.93E-07 ± 1.41E-08 3.78 ± 0.83 3.27 ± 0.36 1.77 ± 0.15 bn090502777 1.73E-06 ± 1.60E-08 2.91 ± 0.51 2.23 ± 0.23 1.39 ± 0.10 bn090509215 3.22E-06 ± 5.03E-08 2.06 ± 0.72 1.41 ± 0.32 1.10 ± 0.17 bn090510016 9.01E-07 ± 1.03E-08 16.22 ± 1.58 8.99 ± 0.75 3.82 ± 0.24 bn090510325 3.17E-07 ± 1.56E-08 0.81 ± 0.32 0.65 ± 0.15 0.47 ± 0.07 bn090511684 8.25E-07 ± 2.34E-08 1.94 ± 0.68 1.44 ± 0.36 1.17 ± 0.19 bn090513916 2.68E-06 ± 9.18E-08 2.12 ± 0.77 1.73 ± 0.41 1.08 ± 0.16 bn090513941 4.83E-07 ± 1.43E-08 0.94 ± 0.34 0.64 ± 0.16 0.41 ± 0.09 bn090514006 3.34E-06 ± 5.32E-08 4.05 ± 0.75 3.11 ± 0.42 2.74 ± 0.19 bn090514726 1.30E-06 ± 1.87E-08 7.18 ± 1.03 6.57 ± 0.56 4.06 ± 0.26 bn090514734 4.99E-06 ± 9.65E-08 2.22 ± 0.97 1.64 ± 0.49 1.22 ± 0.24 bn090516137 9.68E-06 ± 9.67E-08 1.97 ± 0.65 1.41 ± 0.33 1.25 ± 0.16 bn090516353 9.11E-06 ± 2.60E-08 2.61 ± 1.01 1.77 ± 0.43 1.27 ± 0.23 bn090516853 2.25E-06 ± 3.67E-08 4.90 ± 1.07 4.09 ± 0.50 3.31 ± 0.24 bn090518080 4.28E-07 ± 1.02E-08 1.95 ± 1.15 1.48 ± 0.57 1.32 ± 0.31 bn090518244 1.38E-06 ± 4.50E-08 3.85 ± 1.00 3.06 ± 0.45 2.19 ± 0.22 bn090519462 2.12E-06 ± 2.28E-08 1.65 ± 0.91 1.49 ± 0.37 1.02 ± 0.19 bn090519881 1.81E-06 ± 2.24E-08 1.15 ± 0.62 0.76 ± 0.32 0.46 ± 0.15 bn090520832 1.61E-07 ± 1.39E-08 2.76 ± 1.01 1.79 ± 0.43 0.87 ± 0.19 bn090520850 2.06E-06 ± 5.56E-08 4.29 ± 1.00 2.90 ± 0.43 2.48 ± 0.21 bn090520876 2.65E-06 ± 2.24E-08 2.71 ± 0.86 2.32 ± 0.46 1.93 ± 0.23 bn090522344 8.84E-07 ± 1.80E-08 1.95 ± 0.81 1.45 ± 0.38 1.05 ± 0.20 bn090524346 9.49E-06 ± 3.72E-08 6.43 ± 0.85 6.22 ± 0.44 5.77 ± 0.22 bn090528173 2.78E-06 ± 4.64E-08 2.18 ± 0.84 1.41 ± 0.42 1.00 ± 0.20 bn090528516 2.45E-05 ± 4.42E-08 8.45 ± 0.85 7.38 ± 0.45 5.50 ± 0.21 bn090529310 5.64E-07 ± 1.85E-08 1.94 ± 0.72 1.57 ± 0.33 1.24 ± 0.16 bn090529564 4.85E-06 ± 1.91E-08 15.73 ± 1.15 12.99 ± 0.56 10.53 ± 0.27 bn090530760 3.14E-05 ± 8.32E-08 6.11 ± 0.90 5.47 ± 0.46 4.94 ± 0.23 bn090531775 1.60E-07 ± 1.10E-08 2.74 ± 0.56 1.61 ± 0.22 1.06 ± 0.09 bn090602564 1.15E-06 ± 2.79E-08 1.10 ± 0.57 0.73 ± 0.14 0.51 ± 0.08

– 188 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090606471 5.60E-07 ± 4.43E-08 2.48 ± 1.16 1.17 ± 0.47 0.74 ± 0.22 bn090608052 6.16E-07 ± 7.98E-09 1.44 ± 0.80 1.07 ± 0.36 0.67 ± 0.17 bn090610648 7.45E-07 ± 3.21E-08 1.90 ± 0.65 1.63 ± 0.29 1.48 ± 0.15 bn090610723 2.23E-06 ± 3.41E-08 1.49 ± 0.46 0.82 ± 0.17 0.59 ± 0.07 bn090610883 3.92E-07 ± 1.20E-08 1.02 ± 0.52 0.84 ± 0.21 0.54 ± 0.09 bn090612619 3.29E-06 ± 4.03E-08 4.22 ± 0.96 3.40 ± 0.47 3.22 ± 0.23 bn090616157 2.03E-07 ± 1.17E-08 1.57 ± 0.70 1.46 ± 0.32 0.98 ± 0.15 bn090617208 3.59E-07 ± 8.17E-09 9.74 ± 0.81 5.99 ± 0.38 1.52 ± 0.14 bn090618353 1.42E-04 ± 2.33E-07 35.50 ± 2.57 32.42 ± 1.25 29.98 ± 0.61 bn090620400 9.18E-06 ± 2.61E-08 13.18 ± 0.78 11.50 ± 0.38 9.75 ± 0.18 bn090620901 2.32E-07 ± 1.65E-08 1.76 ± 0.71 1.36 ± 0.29 1.06 ± 0.14 bn090621185 5.42E-06 ± 1.11E-07 1.93 ± 0.71 1.28 ± 0.38 1.03 ± 0.19 bn090621417 2.07E-06 ± 4.99E-08 2.36 ± 0.70 1.87 ± 0.36 1.41 ± 0.17 bn090621447 8.38E-07 ± 2.47E-08 1.37 ± 0.36 0.97 ± 0.17 0.71 ± 0.07 bn090621922 1.97E-07 ± 1.16E-08 5.80 ± 0.91 2.96 ± 0.37 0.92 ± 0.12 bn090623107 5.58E-06 ± 3.70E-08 5.01 ± 0.77 4.44 ± 0.38 3.23 ± 0.18 bn090623913 1.30E-06 ± 3.06E-08 2.59 ± 0.51 2.01 ± 0.22 1.16 ± 0.08 bn090625234 8.37E-07 ± 7.05E-09 1.45 ± 0.47 0.86 ± 0.25 0.59 ± 0.13 bn090625560 1.49E-06 ± 4.43E-08 2.72 ± 1.20 1.91 ± 0.53 1.27 ± 0.26 bn090626189 3.38E-05 ± 5.85E-08 27.26 ± 1.85 23.93 ± 0.83 16.05 ± 0.35 bn090626707 3.38E-05 ± 5.85E-08 27.26 ± 1.85 23.93 ± 0.83 16.05 ± 0.35 bn090629543 2.23E-07 ± 1.39E-08 0.80 ± 0.34 0.48 ± 0.17 0.25 ± 0.06 bn090630311 5.42E-07 ± 6.37E-09 2.79 ± 0.83 2.29 ± 0.41 1.84 ± 0.20 bn090701225 2.32E-07 ± 9.12E-09 1.69 ± 0.72 1.29 ± 0.36 1.05 ± 0.18 bn090703329 4.51E-07 ± 1.57E-08 1.84 ± 0.45 1.26 ± 0.21 0.74 ± 0.08 bn090704242 4.17E-06 ± 4.60E-08 2.60 ± 0.88 1.19 ± 0.45 0.77 ± 0.21 bn090704783 8.34E-07 ± 1.96E-08 1.03 ± 0.43 0.77 ± 0.21 0.57 ± 0.08 bn090706283 3.15E-06 ± 3.66E-08 1.54 ± 0.97 0.86 ± 0.43 0.61 ± 0.24 bn090708152 5.26E-07 ± 1.67E-08 0.78 ± 0.32 0.54 ± 0.14 0.37 ± 0.05 bn090709630 1.28E-06 ± 2.40E-08 2.04 ± 0.60 1.58 ± 0.30 1.34 ± 0.15 bn090711850 2.89E-06 ± 4.31E-08 2.73 ± 0.79 1.71 ± 0.44 1.48 ± 0.21 bn090712160 4.18E-06 ± 1.48E-07 1.95 ± 0.66 0.87 ± 0.28 0.76 ± 0.15

– 189 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090713020 5.39E-06 ± 1.95E-08 2.65 ± 0.79 1.60 ± 0.38 1.26 ± 0.18 bn090717034 1.31E-05 ± 3.95E-08 8.29 ± 0.92 6.89 ± 0.50 6.18 ± 0.24 bn090717111 1.57E-07 ± 1.26E-08 1.94 ± 0.50 1.74 ± 0.26 0.84 ± 0.13 bn090718720 1.89E-06 ± 1.91E-08 1.64 ± 1.02 1.12 ± 0.42 0.55 ± 0.20 bn090718762 1.36E-05 ± 5.60E-08 15.54 ± 1.29 14.52 ± 0.65 12.71 ± 0.33 bn090719063 2.69E-05 ± 8.15E-08 23.37 ± 1.61 21.86 ± 0.79 21.17 ± 0.39 bn090720276 2.00E-06 ± 1.56E-08 5.96 ± 1.31 4.80 ± 0.63 4.28 ± 0.31 bn090720710 4.82E-06 ± 1.15E-08 18.04 ± 0.98 14.59 ± 0.45 4.69 ± 0.14 bn090725838 1.29E-06 ± 2.58E-08 1.76 ± 1.11 1.38 ± 0.53 1.03 ± 0.27 bn090726218 3.06E-07 ± 1.03E-08 0.86 ± 0.38 1.03 ± 0.21 0.36 ± 0.05 bn090730608 1.92E-06 ± 4.26E-08 3.49 ± 0.41 3.00 ± 0.19 2.44 ± 0.09 bn090802235 5.79E-07 ± 1.81E-08 18.07 ± 1.75 10.58 ± 0.73 2.80 ± 0.24 bn090802666 1.45E-06 ± 3.16E-08 1.64 ± 0.98 1.18 ± 0.46 0.85 ± 0.24 bn090804940 9.73E-06 ± 7.24E-08 19.40 ± 1.68 18.70 ± 0.80 16.36 ± 0.41 bn090805622 2.50E-06 ± 2.79E-08 2.32 ± 1.45 1.31 ± 0.77 0.92 ± 0.34 bn090807832 5.53E-07 ± 1.31E-08 4.98 ± 0.50 3.85 ± 0.24 1.73 ± 0.09 bn090809978 1.20E-05 ± 7.03E-08 13.56 ± 1.16 12.52 ± 0.58 11.27 ± 0.28 bn090810659 4.53E-06 ± 4.23E-08 2.34 ± 1.38 1.63 ± 0.65 1.26 ± 0.32 bn090810781 2.47E-06 ± 2.90E-08 1.58 ± 0.71 1.09 ± 0.40 0.85 ± 0.19 bn090811696 4.59E-07 ± 1.14E-08 2.14 ± 0.83 1.43 ± 0.40 0.74 ± 0.20 bn090813174 1.81E-06 ± 2.24E-08 15.16 ± 1.10 10.02 ± 0.53 5.59 ± 0.25 bn090814368 2.78E-07 ± 3.08E-09 5.52 ± 0.67 4.37 ± 0.32 1.16 ± 0.12 bn090814950 8.73E-06 ± 1.91E-07 3.22 ± 0.96 2.60 ± 0.41 2.11 ± 0.20 bn090815300 7.86E-07 ± 2.26E-08 1.00 ± 0.44 1.07 ± 0.20 0.49 ± 0.06 bn090815438 2.44E-06 ± 8.04E-08 2.75 ± 1.07 2.34 ± 0.58 2.14 ± 0.28 bn090815946 1.52E-06 ± 1.51E-08 0.94 ± 0.40 0.52 ± 0.14 0.36 ± 0.05 bn090817036 2.54E-06 ± 5.90E-08 3.53 ± 0.70 1.92 ± 0.26 1.30 ± 0.10 bn090819607 1.36E-07 ± 8.29E-09 4.11 ± 0.70 2.37 ± 0.32 0.65 ± 0.13 bn090820027 9.11E-05 ± 8.84E-08 68.12 ± 2.98 67.23 ± 1.45 63.17 ± 0.71 bn090820509 5.47E-07 ± 1.99E-08 4.25 ± 0.82 2.64 ± 0.42 1.25 ± 0.15 bn090823133 1.43E-06 ± 2.77E-08 1.53 ± 0.94 1.23 ± 0.47 0.80 ± 0.22 bn090824918 1.77E-06 ± 3.25E-08 2.38 ± 1.14 1.29 ± 0.52 0.70 ± 0.25

– 190 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn090826068 4.75E-07 ± 2.26E-08 1.76 ± 0.68 1.50 ± 0.32 1.12 ± 0.16 bn090828099 1.28E-05 ± 1.02E-07 7.06 ± 1.21 6.27 ± 0.60 5.80 ± 0.30 bn090829672 3.83E-05 ± 8.43E-08 25.44 ± 1.35 20.88 ± 0.66 16.25 ± 0.32 bn090829702 2.67E-06 ± 2.70E-08 1.84 ± 0.58 1.38 ± 0.27 1.10 ± 0.14 bn090831317 4.82E-06 ± 2.93E-08 19.27 ± 1.56 9.00 ± 0.68 2.58 ± 0.26 bn090902401 7.35E-07 ± 2.23E-08 3.66 ± 0.74 3.14 ± 0.30 2.35 ± 0.15 bn090902462 9.44E-05 ± 1.77E-07 47.05 ± 1.92 39.91 ± 0.92 32.14 ± 0.44 bn090904058 1.16E-05 ± 1.13E-07 3.57 ± 0.67 2.96 ± 0.29 2.33 ± 0.14 bn090904581 8.69E-07 ± 1.49E-08 0.87 ± 0.39 0.46 ± 0.12 0.31 ± 0.06 bn090907017 2.80E-06 ± 6.52E-08 2.72 ± 1.03 1.73 ± 0.51 1.22 ± 0.24 bn090907808 5.84E-07 ± 1.22E-08 4.66 ± 0.51 4.48 ± 0.28 2.56 ± 0.11 bn090908314 1.92E-06 ± 4.02E-08 2.09 ± 0.76 1.56 ± 0.45 1.07 ± 0.23 bn090908341 1.25E-06 ± 6.49E-09 2.72 ± 0.71 1.65 ± 0.35 1.11 ± 0.16 bn090909487 3.06E-06 ± 8.64E-08 5.11 ± 1.57 2.39 ± 0.55 1.72 ± 0.25 bn090909854 1.03E-07 ± 1.12E-08 2.66 ± 0.45 1.37 ± 0.16 0.67 ± 0.07 bn090910812 1.07E-05 ± 1.16E-07 3.54 ± 0.72 2.60 ± 0.29 2.31 ± 0.15 bn090912660 5.66E-06 ± 8.75E-08 1.60 ± 0.35 1.11 ± 0.15 0.73 ± 0.07 bn090915650 1.72E-06 ± 2.71E-08 2.01 ± 0.83 1.29 ± 0.41 0.95 ± 0.20 bn090917661 5.84E-07 ± 2.03E-08 1.57 ± 0.35 1.05 ± 0.18 0.79 ± 0.08 bn090920035 1.75E-06 ± 1.98E-08 2.19 ± 1.45 1.23 ± 0.70 0.91 ± 0.33 bn090922539 6.42E-06 ± 2.67E-08 7.98 ± 0.87 7.37 ± 0.49 6.88 ± 0.23 bn090922605 2.46E-06 ± 5.29E-08 6.78 ± 1.39 4.19 ± 0.54 1.58 ± 0.19 bn090924625 1.71E-07 ± 6.86E-09 4.79 ± 0.82 2.98 ± 0.34 0.80 ± 0.15 bn090925389 4.97E-06 ± 1.61E-07 3.27 ± 0.97 2.53 ± 0.52 1.86 ± 0.24 bn090926181 7.44E-05 ± 1.79E-07 48.53 ± 1.56 48.06 ± 0.78 43.10 ± 0.37 bn090926914 6.68E-06 ± 8.19E-08 2.84 ± 0.89 2.21 ± 0.41 1.80 ± 0.22 bn090927422 1.24E-07 ± 9.01E-09 2.50 ± 1.09 1.60 ± 0.59 0.73 ± 0.27 bn090928646 1.16E-06 ± 2.79E-08 2.78 ± 1.13 1.97 ± 0.53 1.56 ± 0.30 bn090929190 3.86E-06 ± 5.08E-08 14.90 ± 1.66 13.54 ± 0.94 9.09 ± 0.41 bn091002685 1.63E-07 ± 6.14E-09 1.70 ± 0.59 1.45 ± 0.33 0.91 ± 0.17 bn091003191 1.20E-05 ± 3.73E-08 22.19 ± 2.11 19.68 ± 1.04 14.57 ± 0.49 bn091005679 7.91E-07 ± 3.27E-08 1.70 ± 0.70 1.27 ± 0.29 0.94 ± 0.13

– 191 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn091006360 7.82E-08 ± 9.67E-09 2.47 ± 0.52 1.93 ± 0.23 0.71 ± 0.10 bn091010113 6.00E-06 ± 2.99E-08 37.33 ± 1.75 33.35 ± 0.88 16.76 ± 0.39 bn091012783 8.03E-07 ± 2.29E-08 9.35 ± 1.09 6.35 ± 0.47 3.88 ± 0.19 bn091015129 7.88E-07 ± 2.65E-08 2.92 ± 0.97 2.10 ± 0.46 1.58 ± 0.20 bn091017861 2.38E-07 ± 7.90E-09 1.30 ± 0.45 1.09 ± 0.20 0.86 ± 0.09 bn091017985 1.15E-06 ± 1.68E-08 1.10 ± 0.38 0.99 ± 0.18 0.57 ± 0.07 bn091018957 1.16E-07 ± 1.40E-08 5.77 ± 2.68 3.46 ± 1.13 1.14 ± 0.41 bn091019750 6.08E-08 ± 3.03E-09 4.48 ± 0.69 1.28 ± 0.28 0.34 ± 0.13 bn091020900 4.52E-06 ± 8.08E-08 3.72 ± 1.07 3.33 ± 0.55 2.90 ± 0.27 bn091020977 5.22E-06 ± 2.94E-08 4.93 ± 0.60 4.08 ± 0.31 3.50 ± 0.15 bn091023021 2.56E-07 ± 1.01E-08 2.29 ± 0.59 1.51 ± 0.25 1.19 ± 0.12 bn091024372 4.97E-06 ± 3.47E-08 2.54 ± 0.66 1.49 ± 0.21 1.18 ± 0.10 bn091024380 1.47E-05 ± 2.67E-08 2.15 ± 0.58 1.37 ± 0.22 0.93 ± 0.09 bn091026485 3.15E-07 ± 1.18E-08 2.35 ± 0.96 1.48 ± 0.42 0.75 ± 0.20 bn091026550 7.17E-07 ± 2.72E-08 4.10 ± 2.06 2.09 ± 0.90 1.21 ± 0.49 bn091030613 2.57E-06 ± 1.87E-08 2.79 ± 0.64 2.04 ± 0.40 1.50 ± 0.20 bn091030828 1.40E-05 ± 8.43E-08 5.69 ± 0.90 5.15 ± 0.47 4.96 ± 0.22 bn091031500 8.04E-06 ± 4.47E-08 5.47 ± 0.85 4.28 ± 0.43 3.54 ± 0.22 bn091101143 4.27E-06 ± 4.38E-08 8.70 ± 1.15 6.80 ± 0.57 5.93 ± 0.28 bn091102607 1.06E-06 ± 6.28E-08 3.21 ± 0.91 2.11 ± 0.41 1.34 ± 0.20 bn091103912 3.30E-06 ± 6.38E-08 4.16 ± 0.63 3.67 ± 0.40 3.23 ± 0.20 bn091106762 7.85E-07 ± 3.76E-08 2.07 ± 1.48 1.03 ± 0.65 0.52 ± 0.29 bn091107635 5.37E-07 ± 2.29E-08 1.70 ± 0.32 1.14 ± 0.17 0.95 ± 0.08 bn091109895 1.15E-06 ± 2.91E-08 5.18 ± 0.63 4.37 ± 0.29 2.29 ± 0.12 bn091112737 4.04E-06 ± 2.87E-08 2.94 ± 0.80 2.04 ± 0.39 1.77 ± 0.19 bn091112928 2.65E-06 ± 2.67E-08 2.49 ± 0.67 1.62 ± 0.35 1.12 ± 0.17 bn091115177 8.38E-07 ± 3.16E-08 1.14 ± 0.40 0.55 ± 0.13 0.35 ± 0.05 bn091117080 1.85E-06 ± 2.41E-08 2.00 ± 0.51 0.88 ± 0.21 0.57 ± 0.10 bn091120191 1.61E-05 ± 2.00E-07 10.95 ± 1.08 10.07 ± 0.56 7.28 ± 0.26 bn091122163 6.89E-08 ± 1.73E-08 0.75 ± 0.25 0.65 ± 0.12 0.39 ± 0.06 bn091123081 1.14E-06 ± 4.78E-08 2.09 ± 0.63 1.54 ± 0.27 1.32 ± 0.14 bn091123298 3.40E-05 ± 2.00E-07 4.47 ± 1.15 3.69 ± 0.53 2.59 ± 0.25

– 192 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn091126333 2.24E-07 ± 1.66E-08 6.19 ± 0.92 4.50 ± 0.42 1.14 ± 0.15 bn091126389 2.24E-07 ± 1.66E-08 6.19 ± 0.92 4.50 ± 0.42 1.14 ± 0.15 bn091127976 9.43E-06 ± 2.00E-08 31.08 ± 2.04 25.97 ± 0.95 16.71 ± 0.45 bn091128285 2.34E-05 ± 2.38E-07 7.35 ± 1.26 6.01 ± 0.59 5.09 ± 0.26 bn091201089 4.48E-07 ± 9.54E-09 1.00 ± 0.45 0.65 ± 0.25 0.52 ± 0.12 bn091202072 8.76E-07 ± 1.97E-08 1.84 ± 0.71 1.11 ± 0.35 0.85 ± 0.18 bn091202219 3.47E-06 ± 8.36E-08 1.71 ± 0.80 1.50 ± 0.39 1.12 ± 0.18 bn091207333 2.94E-06 ± 5.80E-08 2.58 ± 0.80 1.97 ± 0.36 1.60 ± 0.18 bn091208410 3.17E-06 ± 9.86E-08 11.08 ± 1.43 10.47 ± 0.68 6.96 ± 0.32 bn091209001 5.46E-06 ± 1.02E-07 3.76 ± 0.95 2.25 ± 0.40 1.69 ± 0.19 bn091215234 4.38E-07 ± 3.35E-09 1.29 ± 0.35 0.81 ± 0.17 0.59 ± 0.08 bn091219462 4.51E-07 ± 1.35E-08 2.54 ± 0.48 2.11 ± 0.23 1.29 ± 0.09 bn091220442 3.09E-06 ± 2.49E-08 3.43 ± 0.95 2.71 ± 0.48 2.52 ± 0.24 bn091221870 5.27E-06 ± 9.28E-08 3.35 ± 0.73 2.76 ± 0.33 2.17 ± 0.16 bn091223191 1.56E-07 ± 2.44E-09 2.56 ± 0.61 1.80 ± 0.29 0.75 ± 0.14 bn091223511 5.27E-06 ± 3.33E-08 2.25 ± 0.82 1.57 ± 0.33 1.14 ± 0.15 bn091224373 1.41E-07 ± 6.52E-09 3.04 ± 0.87 1.72 ± 0.38 0.65 ± 0.15 bn091227294 3.81E-06 ± 5.71E-08 3.13 ± 0.80 2.28 ± 0.38 2.00 ± 0.19 bn091230260 1.06E-06 ± 2.29E-08 0.97 ± 0.32 0.60 ± 0.15 0.36 ± 0.07 bn091230712 1.50E-06 ± 4.79E-08 2.33 ± 0.92 1.45 ± 0.49 1.07 ± 0.24 bn091231206 5.58E-06 ± 1.06E-07 2.35 ± 0.63 2.01 ± 0.33 1.83 ± 0.17 bn091231540 4.06E-07 ± 1.60E-08 0.83 ± 0.45 0.62 ± 0.13 0.46 ± 0.06 bn100101028 2.50E-07 ± 9.38E-09 2.29 ± 0.79 1.34 ± 0.36 0.64 ± 0.12 bn100101988 3.75E-07 ± 1.18E-08 1.34 ± 0.55 1.15 ± 0.24 0.84 ± 0.12 bn100107074 9.05E-08 ± 1.10E-08 6.43 ± 1.49 1.70 ± 0.50 0.63 ± 0.23 bn100111176 6.01E-07 ± 8.87E-09 1.18 ± 0.91 1.05 ± 0.44 0.69 ± 0.19 bn100112418 5.56E-07 ± 5.99E-09 0.89 ± 0.34 0.49 ± 0.14 0.36 ± 0.06 bn100116897 1.28E-05 ± 6.14E-08 7.83 ± 1.03 7.06 ± 0.48 6.73 ± 0.23 bn100117879 1.98E-07 ± 2.74E-08 5.23 ± 0.86 3.61 ± 0.39 0.99 ± 0.14 bn100118100 7.91E-07 ± 5.19E-08 1.74 ± 0.97 1.55 ± 0.36 1.31 ± 0.17 bn100122616 5.79E-06 ± 8.58E-08 11.05 ± 1.69 10.29 ± 0.91 9.45 ± 0.44 bn100126460 5.31E-07 ± 3.24E-08 2.38 ± 0.82 1.19 ± 0.41 0.74 ± 0.16

– 193 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100130729 4.69E-06 ± 4.67E-08 3.45 ± 0.80 2.57 ± 0.38 2.06 ± 0.20 bn100130777 7.37E-06 ± 7.43E-08 2.16 ± 0.69 1.74 ± 0.40 1.28 ± 0.18 bn100131730 4.29E-06 ± 4.35E-08 19.51 ± 1.36 16.46 ± 0.64 12.00 ± 0.27 bn100201588 5.41E-06 ± 3.07E-08 2.13 ± 0.56 1.18 ± 0.33 0.78 ± 0.18 bn100204024 6.09E-06 ± 7.98E-08 2.36 ± 0.68 2.25 ± 0.32 1.60 ± 0.17 bn100204566 1.97E-06 ± 2.20E-08 2.46 ± 1.26 1.60 ± 0.48 1.13 ± 0.29 bn100204858 1.71E-07 ± 1.47E-08 2.00 ± 0.86 1.66 ± 0.33 0.71 ± 0.15 bn100205490 7.95E-07 ± 1.42E-08 1.58 ± 0.80 1.26 ± 0.40 0.85 ± 0.20 bn100206563 3.43E-07 ± 8.34E-09 12.72 ± 0.98 6.12 ± 0.40 1.43 ± 0.14 bn100207665 1.26E-06 ± 2.57E-08 1.77 ± 0.90 1.41 ± 0.45 0.92 ± 0.18 bn100207721 2.28E-07 ± 1.20E-08 0.74 ± 0.60 0.40 ± 0.29 0.28 ± 0.15 bn100208386 4.33E-08 ± 3.39E-09 1.20 ± 1.07 0.92 ± 0.60 0.23 ± 0.22 bn100210101 1.21E-06 ± 1.45E-08 1.74 ± 0.72 1.16 ± 0.37 0.96 ± 0.19 bn100211440 7.80E-06 ± 7.88E-08 4.39 ± 1.32 3.46 ± 0.77 3.20 ± 0.37 bn100212550 1.52E-06 ± 3.59E-08 2.96 ± 0.72 2.75 ± 0.33 2.13 ± 0.16 bn100212588 2.06E-07 ± 8.49E-09 1.94 ± 0.86 1.50 ± 0.41 0.96 ± 0.21 bn100216422 1.50E-07 ± 8.42E-09 4.46 ± 0.76 2.68 ± 0.28 0.70 ± 0.11 bn100218194 1.55E-06 ± 6.08E-08 1.35 ± 0.51 0.67 ± 0.32 0.52 ± 0.15 bn100219026 1.74E-06 ± 3.10E-08 2.94 ± 1.08 1.51 ± 0.48 0.64 ± 0.22 bn100221368 1.05E-06 ± 1.56E-08 1.38 ± 0.67 1.11 ± 0.32 0.69 ± 0.16 bn100223110 3.09E-07 ± 3.39E-09 7.49 ± 0.87 4.58 ± 0.58 1.28 ± 0.20 bn100224112 5.77E-06 ± 1.87E-07 6.81 ± 1.06 6.22 ± 0.58 5.03 ± 0.29 bn100225115 3.06E-06 ± 4.85E-08 3.49 ± 0.61 2.70 ± 0.30 2.13 ± 0.15 bn100225249 3.25E-07 ± 3.31E-08 1.25 ± 0.61 0.69 ± 0.18 0.34 ± 0.09 bn100225580 3.45E-06 ± 6.07E-08 7.03 ± 0.82 6.29 ± 0.43 5.32 ± 0.20 bn100225703 8.14E-07 ± 2.25E-08 2.32 ± 0.60 2.02 ± 0.28 1.60 ± 0.14 bn100228544 1.46E-06 ± 2.68E-08 0.97 ± 0.73 0.55 ± 0.34 0.34 ± 0.16 bn100228873 3.43E-07 ± 8.98E-09 1.21 ± 0.74 0.75 ± 0.34 0.57 ± 0.17 bn100301068 1.41E-07 ± 6.60E-09 5.20 ± 1.05 2.24 ± 0.46 0.68 ± 0.20 bn100301223 1.38E-06 ± 3.31E-08 2.57 ± 0.80 1.86 ± 0.37 1.28 ± 0.19 bn100304004 3.13E-06 ± 8.27E-08 2.60 ± 1.31 1.60 ± 0.43 1.26 ± 0.27 bn100304534 2.65E-06 ± 8.94E-08 2.50 ± 1.10 2.08 ± 0.53 1.55 ± 0.27

– 194 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100306199 3.26E-07 ± 1.37E-08 1.32 ± 0.40 0.81 ± 0.19 0.57 ± 0.09 bn100307928 7.13E-07 ± 1.22E-08 2.08 ± 0.71 1.35 ± 0.37 0.83 ± 0.18 bn100311518 1.43E-06 ± 5.40E-08 2.33 ± 0.84 1.44 ± 0.35 1.14 ± 0.16 bn100313288 2.77E-06 ± 3.41E-08 4.45 ± 0.72 3.66 ± 0.38 3.22 ± 0.21 bn100313509 1.30E-06 ± 2.23E-08 1.02 ± 0.38 0.74 ± 0.16 0.45 ± 0.06 bn100315361 1.36E-06 ± 2.42E-08 1.22 ± 0.40 0.67 ± 0.17 0.45 ± 0.08 bn100318611 9.50E-07 ± 1.13E-08 1.61 ± 0.82 0.82 ± 0.40 0.59 ± 0.20 bn100322045 2.94E-05 ± 1.07E-07 10.67 ± 0.84 9.39 ± 0.39 7.79 ± 0.19 bn100323542 1.07E-06 ± 7.14E-08 2.35 ± 0.93 1.61 ± 0.45 1.26 ± 0.22 bn100324172 1.95E-05 ± 9.77E-08 20.84 ± 1.26 19.50 ± 0.64 16.45 ± 0.30 bn100325246 5.74E-07 ± 8.43E-09 1.68 ± 0.77 1.40 ± 0.47 1.22 ± 0.24 bn100325275 2.11E-06 ± 2.76E-08 4.53 ± 0.63 3.51 ± 0.31 2.80 ± 0.14 bn100326294 2.43E-07 ± 3.56E-08 2.84 ± 0.51 2.13 ± 0.24 1.03 ± 0.11 bn100326402 6.18E-06 ± 1.33E-07 2.10 ± 0.74 1.40 ± 0.36 0.94 ± 0.20 bn100328141 3.72E-07 ± 1.15E-08 6.53 ± 0.62 5.53 ± 0.36 2.15 ± 0.14 bn100330309 2.44E-06 ± 2.82E-08 3.78 ± 0.50 3.16 ± 0.25 2.94 ± 0.12 bn100330856 3.07E-07 ± 6.52E-09 1.36 ± 0.67 0.83 ± 0.34 0.71 ± 0.17 bn100401297 9.64E-07 ± 1.52E-08 1.78 ± 0.38 1.73 ± 0.19 1.24 ± 0.08 bn100406758 7.23E-07 ± 2.24E-08 1.96 ± 0.71 1.44 ± 0.37 1.29 ± 0.18 bn100410356 4.55E-07 ± 2.07E-08 0.88 ± 0.34 0.81 ± 0.25 0.47 ± 0.09 bn100410740 2.92E-06 ± 1.51E-07 5.20 ± 2.37 3.82 ± 1.44 2.67 ± 0.69 bn100411516 1.15E-07 ± 9.52E-09 3.37 ± 0.47 1.24 ± 0.19 0.62 ± 0.08 bn100413732 6.18E-06 ± 4.53E-08 1.81 ± 0.82 1.12 ± 0.44 0.74 ± 0.19 bn100414097 3.34E-05 ± 1.04E-07 14.51 ± 1.05 13.34 ± 0.52 10.98 ± 0.24 bn100417166 1.75E-07 ± 1.96E-09 4.22 ± 0.71 2.24 ± 0.35 0.59 ± 0.13 bn100417789 8.95E-07 ± 2.86E-08 1.64 ± 0.86 0.75 ± 0.41 0.62 ± 0.20 bn100420008 2.54E-06 ± 1.98E-08 3.62 ± 0.84 2.90 ± 0.37 2.06 ± 0.18 bn100421917 4.16E-06 ± 1.21E-07 2.42 ± 0.93 1.79 ± 0.42 1.44 ± 0.20 bn100423244 4.02E-06 ± 5.87E-08 2.59 ± 0.59 2.14 ± 0.32 1.89 ± 0.15 bn100424729 3.97E-06 ± 3.06E-08 2.09 ± 0.52 1.25 ± 0.20 0.75 ± 0.08 bn100424876 7.49E-06 ± 6.97E-08 3.18 ± 0.81 2.57 ± 0.37 2.08 ± 0.18 bn100427356 1.28E-06 ± 3.48E-08 2.85 ± 0.82 1.88 ± 0.39 1.30 ± 0.20

– 195 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100429999 1.69E-06 ± 2.39E-08 2.10 ± 0.66 1.28 ± 0.34 0.94 ± 0.16 bn100502356 8.66E-06 ± 1.05E-07 3.36 ± 0.61 2.86 ± 0.37 2.48 ± 0.20 bn100503554 9.69E-06 ± 2.03E-07 5.11 ± 0.75 4.16 ± 0.36 2.71 ± 0.18 bn100504806 1.06E-06 ± 5.76E-08 0.96 ± 0.36 0.75 ± 0.15 0.56 ± 0.07 bn100506653 1.41E-06 ± 3.37E-08 1.97 ± 0.74 1.23 ± 0.38 0.94 ± 0.18 bn100507577 7.14E-06 ± 6.07E-08 2.77 ± 0.52 2.09 ± 0.24 1.82 ± 0.12 bn100510810 1.86E-06 ± 4.10E-08 2.81 ± 1.06 1.35 ± 0.52 1.07 ± 0.26 bn100511035 1.27E-05 ± 3.80E-08 11.89 ± 1.06 10.12 ± 0.51 6.40 ± 0.23 bn100513879 2.19E-06 ± 3.02E-08 3.65 ± 0.85 3.03 ± 0.42 2.52 ± 0.22 bn100515467 3.47E-06 ± 2.87E-08 8.65 ± 1.00 7.71 ± 0.48 6.68 ± 0.24 bn100516369 1.11E-07 ± 7.74E-09 3.14 ± 0.49 1.35 ± 0.17 0.53 ± 0.06 bn100516396 9.15E-08 ± 8.96E-09 1.75 ± 0.47 1.25 ± 0.25 0.50 ± 0.12 bn100517072 3.15E-06 ± 8.16E-09 3.97 ± 0.95 3.53 ± 0.47 3.13 ± 0.24 bn100517132 6.86E-07 ± 2.79E-08 1.50 ± 0.71 1.25 ± 0.29 0.92 ± 0.15 bn100517154 1.27E-06 ± 1.60E-08 6.97 ± 0.75 5.08 ± 0.34 3.10 ± 0.15 bn100517243 1.17E-06 ± 2.46E-08 1.45 ± 0.68 1.26 ± 0.47 1.02 ± 0.21 bn100517639 1.81E-06 ± 7.24E-08 5.18 ± 0.64 4.66 ± 0.31 3.17 ± 0.14 bn100519204 1.15E-05 ± 1.17E-07 2.88 ± 0.80 2.32 ± 0.29 2.15 ± 0.16 bn100522157 2.28E-06 ± 2.93E-08 8.91 ± 0.95 4.93 ± 0.47 3.87 ± 0.25 bn100525744 4.23E-07 ± 4.70E-08 5.60 ± 0.96 3.17 ± 0.44 1.31 ± 0.21 bn100527795 8.36E-06 ± 3.66E-08 4.33 ± 0.66 3.70 ± 0.32 3.13 ± 0.15 bn100528075 1.41E-05 ± 2.71E-08 7.37 ± 1.06 6.56 ± 0.52 6.22 ± 0.25 bn100530737 2.72E-07 ± 9.60E-09 1.40 ± 0.57 1.09 ± 0.36 0.81 ± 0.16 bn100604287 3.05E-06 ± 2.06E-08 3.45 ± 1.14 3.07 ± 0.55 2.85 ± 0.27 bn100605774 4.34E-07 ± 1.19E-08 1.08 ± 0.39 0.78 ± 0.13 0.51 ± 0.06 bn100608382 9.22E-07 ± 1.14E-08 1.62 ± 0.41 1.06 ± 0.19 0.87 ± 0.09 bn100609783 1.14E-05 ± 3.41E-07 2.68 ± 0.81 1.82 ± 0.37 1.28 ± 0.17 bn100612545 6.06E-07 ± 1.76E-08 5.27 ± 0.97 4.21 ± 0.46 2.62 ± 0.21 bn100612726 8.58E-06 ± 2.07E-07 11.81 ± 1.13 11.34 ± 0.54 10.91 ± 0.28 bn100614498 8.92E-06 ± 1.41E-07 1.64 ± 0.80 1.14 ± 0.39 1.01 ± 0.18 bn100615083 4.86E-06 ± 4.43E-08 3.42 ± 0.82 3.07 ± 0.40 2.73 ± 0.20 bn100616773 1.37E-07 ± 8.66E-09 4.24 ± 1.34 2.53 ± 0.60 0.76 ± 0.26

– 196 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100619015 5.95E-06 ± 4.05E-08 3.33 ± 1.02 2.52 ± 0.64 2.10 ± 0.32 bn100620119 2.39E-06 ± 4.26E-08 2.66 ± 0.86 1.86 ± 0.37 1.54 ± 0.20 bn100621452 4.22E-06 ± 1.50E-07 2.10 ± 0.77 1.53 ± 0.35 1.35 ± 0.18 bn100621529 8.33E-08 ± 2.51E-09 1.55 ± 0.64 0.71 ± 0.32 0.46 ± 0.14 bn100625773 4.56E-07 ± 3.62E-08 10.54 ± 1.73 8.49 ± 0.84 2.32 ± 0.30 bn100625891 7.99E-07 ± 8.42E-09 1.13 ± 0.32 0.70 ± 0.13 0.43 ± 0.06 bn100629801 7.43E-07 ± 5.60E-08 10.11 ± 1.80 8.55 ± 0.87 3.88 ± 0.39 bn100701490 8.52E-06 ± 2.41E-08 24.71 ± 1.93 15.06 ± 0.74 9.81 ± 0.31 bn100704149 6.06E-06 ± 6.24E-08 4.28 ± 0.86 3.68 ± 0.41 3.33 ± 0.20 bn100706693 6.55E-08 ± 3.48E-09 2.40 ± 0.69 1.26 ± 0.35 0.29 ± 0.17 bn100707032 4.36E-05 ± 7.80E-08 31.96 ± 1.72 31.24 ± 0.84 29.01 ± 0.42 bn100709602 5.00E-06 ± 4.61E-08 3.04 ± 1.06 2.10 ± 0.47 1.60 ± 0.22 bn100713980 9.13E-07 ± 9.28E-09 3.42 ± 0.62 2.29 ± 0.41 1.61 ± 0.11 bn100714672 1.78E-06 ± 5.30E-08 3.35 ± 1.00 1.91 ± 0.32 1.09 ± 0.16 bn100714686 8.34E-07 ± 2.03E-08 9.55 ± 1.09 7.62 ± 0.51 2.88 ± 0.18 bn100715477 1.44E-06 ± 7.47E-08 1.68 ± 0.61 1.09 ± 0.27 0.76 ± 0.14 bn100717372 2.32E-07 ± 1.27E-08 1.82 ± 0.44 1.37 ± 0.18 0.90 ± 0.08 bn100717446 1.78E-07 ± 7.70E-09 2.39 ± 0.45 1.42 ± 0.18 0.87 ± 0.07 bn100718160 1.59E-06 ± 2.53E-08 2.98 ± 0.48 2.70 ± 0.23 1.55 ± 0.09 bn100718796 1.40E-06 ± 2.17E-08 1.09 ± 0.36 0.72 ± 0.21 0.58 ± 0.08 bn100719311 2.07E-07 ± 1.97E-08 2.02 ± 0.44 1.30 ± 0.21 0.95 ± 0.10 bn100719825 1.50E-07 ± 1.35E-08 1.18 ± 0.54 0.59 ± 0.18 0.46 ± 0.08 bn100719989 2.66E-05 ± 3.67E-07 39.98 ± 2.31 36.56 ± 1.09 28.66 ± 0.50 bn100722096 4.33E-06 ± 2.14E-08 17.50 ± 0.90 15.19 ± 0.42 8.09 ± 0.16 bn100722291 6.28E-08 ± 1.22E-08 1.81 ± 0.51 1.07 ± 0.24 0.42 ± 0.11 bn100724029 9.65E-05 ± 2.75E-07 13.21 ± 0.79 12.05 ± 0.38 11.12 ± 0.18 bn100725475 2.18E-06 ± 1.03E-07 2.03 ± 1.33 1.19 ± 0.56 0.78 ± 0.29 bn100727238 5.63E-07 ± 1.33E-08 0.66 ± 0.25 0.56 ± 0.12 0.41 ± 0.06 bn100728095 6.20E-05 ± 3.14E-07 7.17 ± 0.54 6.10 ± 0.32 5.72 ± 0.17 bn100728439 1.95E-06 ± 3.36E-08 3.30 ± 0.52 2.92 ± 0.25 2.12 ± 0.12 bn100730463 3.88E-06 ± 9.37E-08 2.20 ± 0.67 1.43 ± 0.32 1.15 ± 0.15 bn100802240 6.67E-07 ± 1.75E-08 1.54 ± 0.43 1.08 ± 0.19 0.71 ± 0.09

– 197 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100804104 7.00E-06 ± 1.02E-07 9.39 ± 1.11 8.65 ± 0.57 7.68 ± 0.29 bn100805300 1.11E-07 ± 4.10E-08 11.35 ± 1.78 2.99 ± 0.62 0.83 ± 0.26 bn100805845 6.01E-06 ± 8.89E-08 3.92 ± 0.69 3.72 ± 0.40 3.35 ± 0.20 bn100810049 1.92E-07 ± 2.63E-08 1.33 ± 0.46 0.89 ± 0.21 0.66 ± 0.09 bn100811108 5.83E-07 ± 9.09E-09 7.30 ± 0.69 6.00 ± 0.32 2.31 ± 0.10 bn100811781 2.57E-06 ± 4.43E-08 1.99 ± 0.48 1.70 ± 0.24 1.17 ± 0.11 bn100814160 9.85E-06 ± 5.57E-08 3.48 ± 0.60 2.82 ± 0.29 2.40 ± 0.14 bn100814351 2.50E-06 ± 2.09E-08 3.97 ± 0.61 3.60 ± 0.29 3.14 ± 0.14 bn100816009 1.48E-05 ± 1.32E-07 4.63 ± 1.35 3.02 ± 0.71 2.62 ± 0.36 bn100816026 2.50E-06 ± 3.39E-08 9.86 ± 1.08 8.56 ± 0.52 7.61 ± 0.25 bn100819498 1.81E-06 ± 5.48E-08 1.98 ± 0.71 1.37 ± 0.39 1.06 ± 0.18 bn100820373 1.65E-06 ± 2.88E-08 7.91 ± 0.57 6.30 ± 0.27 5.07 ± 0.12 bn100825287 5.81E-07 ± 1.50E-08 2.65 ± 0.63 2.11 ± 0.28 1.75 ± 0.13 bn100826957 7.76E-05 ± 5.47E-08 17.44 ± 0.99 15.11 ± 0.47 13.79 ± 0.23 bn100827455 3.26E-07 ± 1.21E-08 9.34 ± 0.82 4.39 ± 0.30 1.43 ± 0.09 bn100829374 3.93E-06 ± 2.53E-08 3.93 ± 0.57 3.21 ± 0.27 2.34 ± 0.12 bn100829876 9.07E-06 ± 4.09E-08 50.30 ± 2.08 39.31 ± 1.08 23.22 ± 0.45 bn100831651 1.64E-06 ± 6.52E-08 1.19 ± 0.42 1.20 ± 0.36 0.76 ± 0.10 bn100902990 1.13E-06 ± 2.46E-08 1.68 ± 0.47 0.94 ± 0.19 0.69 ± 0.08 bn100905907 1.11E-06 ± 1.08E-08 2.46 ± 0.61 1.23 ± 0.21 0.91 ± 0.09 bn100906576 1.27E-05 ± 3.21E-08 8.09 ± 0.80 7.53 ± 0.40 5.76 ± 0.18 bn100907751 4.34E-07 ± 3.39E-08 1.81 ± 0.48 1.55 ± 0.23 1.16 ± 0.11 bn100910818 7.92E-06 ± 2.51E-08 17.00 ± 0.78 15.81 ± 0.39 10.65 ± 0.16 bn100911816 4.37E-07 ± 1.70E-08 1.58 ± 0.35 1.11 ± 0.16 0.88 ± 0.08 bn100915243 2.48E-07 ± 1.49E-08 1.04 ± 0.36 0.66 ± 0.17 0.42 ± 0.09 bn100916779 9.24E-07 ± 7.88E-08 10.10 ± 1.33 7.89 ± 0.59 2.49 ± 0.21 bn100918863 5.86E-05 ± 1.48E-06 7.50 ± 0.79 6.44 ± 0.37 5.95 ± 0.18 bn100919884 3.30E-06 ± 4.64E-08 2.38 ± 0.56 1.83 ± 0.34 1.55 ± 0.16 bn100922625 2.18E-07 ± 6.81E-09 0.62 ± 0.25 0.47 ± 0.12 0.36 ± 0.06 bn100923844 2.04E-06 ± 3.00E-08 1.91 ± 0.56 1.56 ± 0.25 1.37 ± 0.13 bn100924165 1.73E-06 ± 1.90E-08 5.55 ± 0.59 4.49 ± 0.35 3.56 ± 0.18 bn100926595 3.77E-06 ± 8.65E-09 3.92 ± 0.75 3.63 ± 0.37 2.69 ± 0.16

– 198 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn100926694 7.67E-07 ± 1.68E-08 1.44 ± 0.39 0.68 ± 0.15 0.44 ± 0.06 bn100929235 3.14E-07 ± 1.09E-08 1.10 ± 0.30 0.60 ± 0.14 0.42 ± 0.06 bn100929315 2.00E-07 ± 1.01E-08 1.55 ± 0.48 0.83 ± 0.18 0.56 ± 0.08 bn100929916 2.92E-07 ± 1.22E-08 7.88 ± 1.08 3.91 ± 0.39 1.44 ± 0.13 bn101002279 2.52E-07 ± 1.89E-08 1.00 ± 0.41 0.52 ± 0.14 0.33 ± 0.07 bn101003244 8.30E-07 ± 1.78E-08 1.84 ± 0.48 1.65 ± 0.17 1.15 ± 0.09 bn101004426 4.77E-06 ± 5.82E-08 2.00 ± 0.50 1.17 ± 0.30 0.85 ± 0.11 bn101008697 7.34E-07 ± 2.40E-08 2.62 ± 0.56 1.65 ± 0.22 0.83 ± 0.08 bn101010190 9.31E-07 ± 3.76E-08 1.24 ± 0.42 0.95 ± 0.19 0.70 ± 0.08 bn101011707 1.45E-06 ± 4.63E-08 2.21 ± 0.70 1.23 ± 0.28 0.65 ± 0.13 bn101013412 3.48E-06 ± 4.28E-08 4.78 ± 0.90 3.86 ± 0.47 2.50 ± 0.21 bn101014175 1.05E-04 ± 2.22E-07 36.28 ± 1.51 35.35 ± 0.76 28.31 ± 0.35 bn101015558 2.10E-05 ± 1.30E-07 2.44 ± 0.64 1.55 ± 0.29 1.33 ± 0.16 bn101016243 1.36E-06 ± 8.41E-09 5.88 ± 0.52 5.79 ± 0.26 4.30 ± 0.12 bn101017619 9.95E-07 ± 9.88E-09 1.12 ± 0.33 0.61 ± 0.10 0.32 ± 0.05 bn101021009 1.10E-05 ± 2.43E-07 6.54 ± 2.28 4.42 ± 0.95 3.60 ± 0.48 bn101021063 1.91E-07 ± 1.11E-08 2.43 ± 0.47 1.29 ± 0.20 0.73 ± 0.08 bn101023951 3.30E-05 ± 3.09E-07 18.57 ± 1.93 17.83 ± 1.02 16.23 ± 0.51 bn101024486 1.92E-06 ± 8.22E-08 5.44 ± 1.16 3.71 ± 0.51 2.64 ± 0.24 bn101025146 1.52E-07 ± 8.50E-09 0.59 ± 0.21 0.44 ± 0.10 0.30 ± 0.05 bn101026034 3.28E-07 ± 1.18E-08 7.47 ± 1.02 5.37 ± 0.47 1.41 ± 0.13 bn101027230 6.80E-08 ± 3.94E-09 2.83 ± 0.60 1.42 ± 0.22 0.36 ± 0.07 bn101030664 2.69E-06 ± 2.10E-08 1.10 ± 0.43 0.70 ± 0.22 0.51 ± 0.07 bn101031625 1.51E-07 ± 1.57E-08 5.23 ± 0.74 3.28 ± 0.31 1.02 ± 0.10 bn101101744 1.90E-07 ± 1.36E-08 2.18 ± 0.51 1.52 ± 0.24 1.12 ± 0.10 bn101101899 1.44E-06 ± 1.26E-08 1.48 ± 0.44 0.74 ± 0.19 0.47 ± 0.08 bn101102840 9.29E-07 ± 1.86E-08 0.82 ± 0.21 0.43 ± 0.14 0.33 ± 0.05 bn101104810 4.21E-07 ± 1.18E-08 3.20 ± 0.71 1.46 ± 0.21 0.85 ± 0.08 bn101107011 3.51E-06 ± 1.23E-07 1.82 ± 1.22 1.14 ± 0.59 0.87 ± 0.27 bn101112924 1.39E-06 ± 4.18E-08 4.18 ± 0.75 3.52 ± 0.34 2.89 ± 0.16 bn101112984 4.49E-06 ± 5.13E-08 1.47 ± 0.44 1.10 ± 0.21 0.85 ± 0.11 bn101113483 1.62E-06 ± 1.61E-08 1.98 ± 0.42 1.61 ± 0.20 1.36 ± 0.10

– 199 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn101116481 1.55E-07 ± 3.62E-08 3.03 ± 0.67 2.00 ± 0.32 0.88 ± 0.14 bn101117496 4.87E-06 ± 4.11E-08 2.73 ± 0.60 1.49 ± 0.22 0.97 ± 0.09 bn101119685 8.61E-08 ± 8.83E-09 2.58 ± 0.70 1.29 ± 0.23 0.59 ± 0.09 bn101123952 5.11E-05 ± 4.49E-08 24.01 ± 1.50 21.86 ± 0.73 19.17 ± 0.34 bn101126198 1.63E-05 ± 7.76E-08 8.88 ± 0.97 8.40 ± 0.52 7.96 ± 0.25 bn101127093 3.75E-07 ± 9.95E-09 0.85 ± 0.41 0.45 ± 0.12 0.31 ± 0.06 bn101127102 1.71E-06 ± 1.56E-08 0.93 ± 0.40 0.63 ± 0.16 0.48 ± 0.07 bn101128322 4.89E-07 ± 8.75E-09 1.70 ± 0.39 1.13 ± 0.19 0.81 ± 0.09 bn101129652 3.91E-07 ± 2.96E-08 7.17 ± 0.73 5.28 ± 0.37 1.97 ± 0.13 bn101129726 4.60E-07 ± 1.44E-08 7.55 ± 0.70 6.15 ± 0.33 2.43 ± 0.11 bn101130074 1.09E-07 ± 2.67E-08 0.71 ± 0.30 0.41 ± 0.18 0.24 ± 0.08 bn101201418 1.21E-05 ± 4.58E-08 3.02 ± 0.48 2.46 ± 0.23 2.11 ± 0.10 bn101202154 6.98E-07 ± 3.25E-08 3.74 ± 0.92 1.50 ± 0.38 0.79 ± 0.16 bn101204343 1.17E-07 ± 6.78E-09 4.08 ± 0.63 2.11 ± 0.23 0.52 ± 0.06 bn101205309 2.17E-07 ± 2.03E-08 0.95 ± 0.41 0.50 ± 0.12 0.32 ± 0.06 bn101206036 3.12E-06 ± 4.36E-08 3.05 ± 0.94 2.36 ± 0.46 2.02 ± 0.22 bn101207536 3.77E-06 ± 3.59E-08 3.06 ± 0.49 2.67 ± 0.24 1.47 ± 0.11 bn101208203 1.08E-07 ± 8.92E-09 2.42 ± 0.75 2.16 ± 0.30 0.63 ± 0.09 bn101208498 2.22E-06 ± 2.82E-08 22.16 ± 1.16 19.96 ± 0.54 10.59 ± 0.21 bn101211485 9.08E-07 ± 2.38E-08 2.64 ± 0.58 1.44 ± 0.27 1.15 ± 0.13 bn101213451 4.07E-06 ± 5.53E-08 3.49 ± 0.86 2.90 ± 0.38 1.36 ± 0.13 bn101213849 7.10E-07 ± 1.13E-08 3.51 ± 0.49 2.58 ± 0.22 1.72 ± 0.10 bn101214748 1.57E-07 ± 1.67E-08 5.02 ± 0.76 2.90 ± 0.32 0.82 ± 0.10 bn101214993 5.83E-07 ± 2.17E-08 1.66 ± 0.39 1.35 ± 0.23 0.87 ± 0.07 bn101216721 1.88E-06 ± 3.86E-08 11.54 ± 0.85 11.15 ± 0.41 8.00 ± 0.18 bn101219686 2.49E-06 ± 3.06E-08 1.49 ± 0.35 0.90 ± 0.18 0.68 ± 0.08 bn101220576 5.68E-06 ± 5.51E-08 3.35 ± 0.87 1.84 ± 0.33 0.97 ± 0.12 bn101220864 2.94E-06 ± 5.57E-08 3.03 ± 0.75 2.71 ± 0.39 2.18 ± 0.20 bn101223834 1.30E-06 ± 2.45E-08 0.93 ± 0.29 0.69 ± 0.19 0.42 ± 0.08 bn101224227 1.06E-07 ± 1.59E-08 2.77 ± 0.44 1.99 ± 0.24 0.53 ± 0.08 bn101224578 1.97E-06 ± 1.08E-08 1.85 ± 0.38 1.39 ± 0.18 1.20 ± 0.08 bn101224614 1.32E-06 ± 3.44E-08 1.61 ± 0.46 1.12 ± 0.22 0.91 ± 0.11

– 200 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn101224998 8.73E-07 ± 1.63E-08 2.34 ± 0.65 1.28 ± 0.22 0.78 ± 0.09 bn101225377 1.14E-05 ± 1.60E-07 4.45 ± 0.63 3.80 ± 0.30 3.20 ± 0.14 bn101227195 1.93E-06 ± 4.95E-08 4.05 ± 0.86 1.75 ± 0.27 1.28 ± 0.13 bn101227406 7.96E-06 ± 5.44E-08 4.37 ± 0.59 3.70 ± 0.28 3.12 ± 0.13 bn101227536 2.56E-06 ± 1.86E-08 4.35 ± 0.63 3.37 ± 0.27 2.07 ± 0.11 bn101231067 9.86E-06 ± 6.17E-08 9.84 ± 0.93 8.81 ± 0.43 6.15 ± 0.20 bn110101202 1.45E-07 ± 1.44E-08 1.38 ± 0.43 0.89 ± 0.15 0.48 ± 0.06 bn110101506 3.53E-06 ± 4.06E-08 1.60 ± 0.45 0.86 ± 0.25 0.45 ± 0.09 bn110102788 1.95E-05 ± 1.15E-07 8.61 ± 0.65 7.66 ± 0.34 6.07 ± 0.15 bn110105877 1.25E-05 ± 6.29E-08 4.94 ± 0.70 4.31 ± 0.32 3.29 ± 0.14 bn110106893 1.96E-06 ± 2.98E-08 1.52 ± 0.50 1.09 ± 0.24 0.82 ± 0.11 bn110107886 7.07E-06 ± 6.68E-08 1.62 ± 0.42 1.50 ± 0.21 1.03 ± 0.08 bn110108977 1.36E-06 ± 2.98E-08 1.06 ± 0.59 0.69 ± 0.16 0.45 ± 0.08 bn110112934 1.84E-07 ± 1.47E-08 4.85 ± 0.69 2.75 ± 0.30 0.86 ± 0.09 bn110117364 1.68E-06 ± 9.30E-08 2.15 ± 0.77 1.47 ± 0.37 0.80 ± 0.17 bn110117626 1.29E-06 ± 9.45E-09 2.43 ± 0.60 1.57 ± 0.23 0.84 ± 0.08 bn110118857 1.60E-06 ± 2.31E-08 3.62 ± 0.49 3.24 ± 0.24 2.71 ± 0.11 bn110119931 5.76E-06 ± 2.54E-08 2.84 ± 0.55 2.33 ± 0.24 1.29 ± 0.09 bn110120666 8.44E-06 ± 1.25E-07 8.17 ± 0.68 7.24 ± 0.39 6.01 ± 0.20 bn110123804 1.13E-05 ± 4.09E-08 5.42 ± 0.56 4.93 ± 0.28 4.53 ± 0.14 bn110124784 8.73E-08 ± 7.35E-09 0.89 ± 0.29 0.38 ± 0.12 0.25 ± 0.05 bn110125894 3.90E-07 ± 1.71E-08 1.33 ± 0.46 1.07 ± 0.15 0.90 ± 0.08 bn110128073 7.76E-07 ± 5.63E-08 1.41 ± 0.42 0.85 ± 0.19 0.68 ± 0.09 bn110130230 1.54E-06 ± 2.14E-08 1.23 ± 0.35 0.78 ± 0.18 0.48 ± 0.06 bn110131780 3.80E-08 ± 9.09E-09 2.17 ± 0.55 1.24 ± 0.20 0.41 ± 0.08 bn110201399 1.69E-06 ± 8.78E-08 3.28 ± 0.91 1.96 ± 0.44 1.53 ± 0.20 bn110204179 1.91E-06 ± 3.68E-08 2.34 ± 0.61 1.82 ± 0.27 1.10 ± 0.10 bn110205027 1.10E-07 ± 1.99E-08 1.01 ± 0.35 0.67 ± 0.17 0.32 ± 0.08 bn110205588 2.20E-06 ± 3.78E-08 1.81 ± 0.84 1.10 ± 0.29 0.72 ± 0.14 bn110206202 4.49E-07 ± 2.20E-08 1.94 ± 0.60 1.35 ± 0.29 0.94 ± 0.14 bn110207470 1.40E-06 ± 2.05E-08 4.78 ± 0.64 2.61 ± 0.27 0.76 ± 0.08 bn110207959 1.90E-07 ± 2.88E-08 0.91 ± 0.32 0.74 ± 0.15 0.50 ± 0.08

– 201 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110209165 4.26E-07 ± 1.96E-08 1.61 ± 0.59 1.24 ± 0.26 0.85 ± 0.11 bn110212550 2.13E-07 ± 6.23E-09 9.43 ± 0.75 4.40 ± 0.27 1.15 ± 0.08 bn110213220 4.72E-06 ± 2.73E-08 6.49 ± 0.85 5.40 ± 0.40 4.75 ± 0.19 bn110213876 6.62E-08 ± 1.47E-08 2.12 ± 0.44 1.27 ± 0.17 0.40 ± 0.07 bn110217591 7.78E-07 ± 2.31E-08 0.82 ± 0.32 0.62 ± 0.12 0.30 ± 0.05 bn110220761 1.20E-06 ± 1.39E-08 1.93 ± 0.39 1.44 ± 0.18 1.17 ± 0.08 bn110221244 1.38E-06 ± 1.90E-08 2.15 ± 0.48 1.76 ± 0.22 1.44 ± 0.10 bn110226989 1.06E-06 ± 1.23E-08 1.37 ± 0.46 0.93 ± 0.17 0.69 ± 0.08 bn110227009 9.59E-08 ± 5.82E-09 1.87 ± 0.49 0.96 ± 0.16 0.50 ± 0.06 bn110227229 1.10E-06 ± 1.40E-08 2.16 ± 0.53 1.32 ± 0.24 1.03 ± 0.11 bn110227420 1.34E-06 ± 4.52E-08 1.74 ± 0.49 1.33 ± 0.21 1.13 ± 0.10 bn110228011 2.77E-06 ± 2.89E-08 3.16 ± 0.73 2.20 ± 0.31 1.59 ± 0.13 bn110228792 5.42E-07 ± 1.15E-08 0.81 ± 0.26 0.50 ± 0.10 0.28 ± 0.05 bn110301214 2.19E-05 ± 1.65E-08 48.69 ± 1.72 44.78 ± 0.83 35.76 ± 0.38 bn110302043 1.67E-06 ± 2.74E-08 1.94 ± 0.48 1.65 ± 0.23 1.30 ± 0.11 bn110304071 2.21E-06 ± 5.13E-08 3.96 ± 0.70 2.94 ± 0.32 2.45 ± 0.15 bn110307972 3.00E-07 ± 2.44E-08 3.06 ± 0.51 2.57 ± 0.24 1.16 ± 0.10 bn110311812 5.31E-07 ± 1.74E-08 2.14 ± 0.53 1.03 ± 0.19 0.78 ± 0.09 bn110316139 6.44E-08 ± 1.84E-08 1.83 ± 0.33 1.02 ± 0.13 0.37 ± 0.06 bn110318552 4.89E-06 ± 4.69E-08 7.33 ± 0.59 6.10 ± 0.29 5.21 ± 0.14 bn110319628 8.20E-07 ± 1.67E-08 1.50 ± 0.48 0.80 ± 0.17 0.58 ± 0.09 bn110319815 1.39E-06 ± 4.66E-08 2.44 ± 0.81 1.11 ± 0.23 0.94 ± 0.13 bn110321346 6.12E-07 ± 2.39E-08 0.67 ± 0.34 0.47 ± 0.09 0.35 ± 0.05 bn110322558 1.98E-06 ± 1.93E-08 2.24 ± 0.45 1.37 ± 0.18 0.78 ± 0.07 bn110328520 8.88E-06 ± 4.33E-08 3.61 ± 0.59 3.01 ± 0.28 2.48 ± 0.12 bn110331604 1.40E-07 ± 1.51E-08 0.92 ± 0.33 0.68 ± 0.12 0.52 ± 0.06 bn110401920 4.61E-07 ± 1.46E-08 6.90 ± 0.81 3.64 ± 0.28 1.64 ± 0.11 bn110402009 3.87E-06 ± 5.94E-08 11.90 ± 1.51 6.67 ± 0.46 3.33 ± 0.20 bn110407998 1.07E-05 ± 9.97E-09 11.04 ± 0.79 10.21 ± 0.38 8.90 ± 0.18 bn110409179 1.55E-07 ± 6.87E-09 6.71 ± 0.61 2.95 ± 0.23 0.70 ± 0.07 bn110410133 3.61E-06 ± 1.00E-08 1.68 ± 0.42 1.41 ± 0.20 0.94 ± 0.08 bn110410772 4.66E-07 ± 1.39E-08 1.79 ± 0.47 1.21 ± 0.18 0.71 ± 0.07

– 202 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110411629 2.03E-06 ± 3.89E-08 3.15 ± 0.83 1.77 ± 0.33 1.19 ± 0.13 bn110412315 1.48E-06 ± 1.59E-08 1.68 ± 0.35 1.03 ± 0.16 0.80 ± 0.08 bn110413938 6.10E-07 ± 1.73E-08 1.04 ± 0.38 0.57 ± 0.12 0.28 ± 0.05 bn110415541 2.67E-06 ± 2.79E-08 3.15 ± 0.68 2.55 ± 0.30 2.31 ± 0.15 bn110420946 1.06E-07 ± 1.35E-08 6.72 ± 1.09 2.26 ± 0.32 0.58 ± 0.10 bn110421757 5.49E-06 ± 4.00E-08 3.18 ± 0.48 3.00 ± 0.24 2.57 ± 0.11 bn110422029 5.69E-08 ± 1.05E-08 2.76 ± 0.41 1.36 ± 0.16 0.53 ± 0.06 bn110424758 2.59E-08 ± 5.02E-09 2.77 ± 0.55 1.14 ± 0.19 0.27 ± 0.08 bn110426629 1.38E-05 ± 5.06E-08 2.18 ± 0.56 1.68 ± 0.27 1.25 ± 0.12 bn110428338 6.84E-06 ± 3.33E-08 4.55 ± 0.59 4.03 ± 0.28 3.26 ± 0.13 bn110428388 1.41E-05 ± 8.13E-08 18.61 ± 0.92 17.42 ± 0.41 15.43 ± 0.20 bn110430375 3.54E-06 ± 2.03E-08 2.16 ± 0.45 1.63 ± 0.19 1.55 ± 0.10 bn110503145 8.88E-07 ± 2.07E-08 2.53 ± 0.47 1.83 ± 0.20 1.34 ± 0.08 bn110505203 1.01E-06 ± 3.38E-08 3.43 ± 0.51 3.07 ± 0.25 2.66 ± 0.12 bn110509142 2.14E-06 ± 2.19E-08 1.31 ± 0.50 0.92 ± 0.21 0.59 ± 0.08 bn110509475 2.39E-07 ± 7.65E-09 4.99 ± 0.55 3.26 ± 0.23 1.24 ± 0.08 bn110511616 2.57E-07 ± 2.34E-08 0.82 ± 0.41 0.65 ± 0.13 0.51 ± 0.07 bn110517453 5.30E-08 ± 1.27E-08 3.03 ± 0.57 1.51 ± 0.21 0.44 ± 0.07 bn110517573 5.82E-06 ± 2.02E-08 5.53 ± 0.61 4.77 ± 0.31 3.65 ± 0.14 bn110517902 5.82E-06 ± 2.02E-08 5.53 ± 0.61 4.77 ± 0.31 3.65 ± 0.14 bn110520302 5.76E-07 ± 2.68E-08 1.33 ± 0.63 0.84 ± 0.19 0.72 ± 0.10 bn110521478 1.71E-06 ± 3.95E-08 8.26 ± 1.24 6.60 ± 0.58 5.27 ± 0.26 bn110522256 1.19E-06 ± 1.73E-08 1.37 ± 0.40 0.61 ± 0.17 0.46 ± 0.06 bn110522296 6.36E-07 ± 1.90E-08 1.38 ± 0.42 0.99 ± 0.18 0.80 ± 0.09 bn110522633 1.22E-06 ± 1.21E-08 3.42 ± 0.54 2.55 ± 0.27 1.95 ± 0.11 bn110523344 1.30E-06 ± 2.45E-08 3.34 ± 0.59 2.18 ± 0.26 1.70 ± 0.12 bn110526715 4.04E-07 ± 1.59E-08 6.39 ± 0.89 4.76 ± 0.40 2.05 ± 0.13 bn110528624 2.67E-06 ± 3.18E-08 1.58 ± 0.45 0.96 ± 0.17 0.55 ± 0.07 bn110529034 7.96E-07 ± 8.35E-09 22.46 ± 0.98 11.88 ± 0.41 4.02 ± 0.13 bn110529262 3.69E-06 ± 2.38E-08 7.32 ± 0.71 7.08 ± 0.36 4.18 ± 0.15 bn110529811 1.95E-06 ± 1.61E-08 1.58 ± 0.41 1.12 ± 0.18 0.68 ± 0.06 bn110531448 1.12E-06 ± 1.37E-08 1.03 ± 0.37 0.72 ± 0.16 0.56 ± 0.07

– 203 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110601681 5.02E-06 ± 6.65E-08 2.89 ± 0.41 2.02 ± 0.21 1.79 ± 0.09 bn110605183 1.16E-05 ± 3.17E-08 5.25 ± 0.69 4.75 ± 0.36 4.31 ± 0.17 bn110605780 3.16E-07 ± 1.16E-08 2.07 ± 0.40 1.26 ± 0.17 0.92 ± 0.08 bn110609185 2.70E-07 ± 1.91E-08 0.98 ± 0.44 0.73 ± 0.14 0.49 ± 0.07 bn110609425 1.19E-06 ± 2.28E-08 1.41 ± 0.34 0.92 ± 0.18 0.64 ± 0.07 bn110610640 4.74E-06 ± 3.35E-08 3.77 ± 0.53 3.10 ± 0.25 2.42 ± 0.11 bn110613631 1.78E-06 ± 2.03E-08 1.21 ± 0.40 0.64 ± 0.14 0.49 ± 0.06 bn110616648 5.88E-07 ± 2.54E-08 1.19 ± 0.62 0.76 ± 0.20 0.51 ± 0.09 bn110618366 3.37E-05 ± 8.90E-08 5.21 ± 1.13 4.30 ± 0.48 3.06 ± 0.21 bn110618760 5.64E-06 ± 2.62E-08 2.66 ± 0.54 1.89 ± 0.23 1.19 ± 0.09 bn110622158 3.09E-05 ± 8.10E-08 8.14 ± 0.70 7.15 ± 0.33 6.79 ± 0.17 bn110624906 1.46E-07 ± 1.80E-08 0.84 ± 0.26 0.64 ± 0.13 0.43 ± 0.06 bn110625579 2.05E-06 ± 1.99E-08 1.75 ± 0.47 1.16 ± 0.17 0.76 ± 0.08 bn110625881 3.91E-05 ± 5.02E-08 39.77 ± 1.55 38.93 ± 0.75 35.88 ± 0.36 bn110626448 5.74E-07 ± 1.61E-08 2.15 ± 0.48 1.61 ± 0.21 1.38 ± 0.11 bn110629174 1.29E-06 ± 1.30E-08 4.77 ± 0.67 4.11 ± 0.31 2.15 ± 0.11 bn110702187 4.37E-06 ± 7.06E-08 3.22 ± 0.70 2.81 ± 0.34 2.28 ± 0.16 bn110703557 5.60E-07 ± 1.09E-08 2.89 ± 0.44 2.23 ± 0.20 1.70 ± 0.09 bn110705151 7.49E-07 ± 1.18E-08 18.25 ± 1.32 12.74 ± 0.58 3.39 ± 0.15 bn110705364 4.98E-06 ± 5.08E-08 4.02 ± 0.51 3.36 ± 0.24 2.86 ± 0.11 bn110706202 2.09E-06 ± 5.60E-08 2.39 ± 0.38 1.84 ± 0.19 1.37 ± 0.10 bn110706477 4.06E-06 ± 4.06E-08 2.14 ± 0.46 1.93 ± 0.21 1.11 ± 0.08 bn110706728 1.39E-06 ± 4.39E-08 3.30 ± 0.60 2.84 ± 0.25 1.81 ± 0.10 bn110706977 3.06E-06 ± 2.46E-08 2.95 ± 0.57 2.25 ± 0.28 1.88 ± 0.12 bn110709463 4.01E-06 ± 2.41E-08 8.04 ± 0.80 7.37 ± 0.39 6.06 ± 0.18 bn110709642 1.92E-05 ± 3.20E-08 8.18 ± 0.85 7.19 ± 0.44 6.05 ± 0.21 bn110709862 4.29E-07 ± 1.35E-08 2.22 ± 0.53 1.27 ± 0.22 0.91 ± 0.10 bn110710954 4.87E-06 ± 2.18E-08 9.46 ± 0.89 7.33 ± 0.41 3.83 ± 0.17 bn110716018 8.14E-07 ± 1.98E-08 7.22 ± 0.83 5.41 ± 0.38 2.23 ± 0.14 bn110717180 1.43E-07 ± 5.96E-09 10.95 ± 1.08 3.32 ± 0.34 0.84 ± 0.13 bn110717319 2.15E-05 ± 2.86E-08 10.01 ± 0.89 8.86 ± 0.43 7.61 ± 0.20 bn110720177 3.27E-06 ± 1.53E-08 3.42 ± 0.49 2.64 ± 0.22 2.36 ± 0.10

– 204 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110721200 1.53E-05 ± 2.09E-08 16.99 ± 0.84 15.78 ± 0.42 14.10 ± 0.20 bn110722694 1.15E-05 ± 5.96E-08 3.19 ± 0.64 2.81 ± 0.28 2.53 ± 0.13 bn110722710 9.83E-07 ± 3.18E-08 2.28 ± 0.55 1.31 ± 0.24 0.90 ± 0.09 bn110725236 7.59E-07 ± 1.33E-08 2.43 ± 0.46 1.90 ± 0.22 1.28 ± 0.09 bn110726211 2.53E-06 ± 5.23E-08 2.56 ± 0.53 1.84 ± 0.23 1.26 ± 0.09 bn110728056 1.69E-07 ± 2.82E-08 2.65 ± 0.48 1.71 ± 0.21 1.05 ± 0.10 bn110729142 2.54E-05 ± 2.63E-08 4.59 ± 0.62 4.15 ± 0.32 3.58 ± 0.15 bn110730008 6.49E-07 ± 1.86E-08 1.18 ± 0.37 0.97 ± 0.17 0.53 ± 0.07 bn110730660 4.00E-06 ± 4.83E-08 3.48 ± 0.79 2.85 ± 0.35 2.30 ± 0.16 bn110731465 1.09E-05 ± 2.90E-08 12.25 ± 0.95 10.36 ± 0.45 8.35 ± 0.21 bn110801335 2.17E-07 ± 2.02E-08 6.10 ± 1.21 4.33 ± 0.50 1.46 ± 0.15 bn110803783 1.61E-06 ± 2.80E-08 0.93 ± 0.32 0.73 ± 0.13 0.56 ± 0.06 bn110806934 3.80E-06 ± 1.43E-08 2.45 ± 0.38 2.16 ± 0.19 1.76 ± 0.09 bn110809461 2.37E-06 ± 5.41E-08 4.18 ± 0.73 3.12 ± 0.30 2.22 ± 0.14 bn110812899 6.15E-07 ± 1.25E-08 1.55 ± 0.44 1.26 ± 0.20 1.06 ± 0.08 bn110813237 2.59E-06 ± 2.11E-08 3.88 ± 0.55 3.11 ± 0.24 2.65 ± 0.12 bn110817191 6.98E-06 ± 2.12E-08 14.41 ± 0.85 13.17 ± 0.42 12.87 ± 0.21 bn110818860 2.78E-06 ± 1.67E-08 1.85 ± 0.41 1.21 ± 0.17 0.74 ± 0.08 bn110819665 1.77E-06 ± 4.43E-08 9.00 ± 1.68 7.66 ± 0.79 5.09 ± 0.33 bn110820476 4.42E-07 ± 2.36E-08 1.11 ± 0.40 0.91 ± 0.18 0.74 ± 0.09 bn110824009 6.16E-06 ± 8.35E-08 14.13 ± 0.85 11.32 ± 0.43 7.31 ± 0.16 bn110825102 2.46E-05 ± 3.93E-08 36.30 ± 1.30 30.62 ± 0.58 25.08 ± 0.26 bn110825265 1.19E-06 ± 2.48E-08 0.67 ± 0.34 0.80 ± 0.18 0.67 ± 0.06 bn110828575 1.39E-06 ± 2.09E-08 1.71 ± 0.49 0.94 ± 0.17 0.66 ± 0.07 bn110831282 2.75E-06 ± 1.89E-08 2.54 ± 0.50 1.83 ± 0.22 1.43 ± 0.11 bn110901230 7.16E-07 ± 2.94E-08 0.93 ± 0.39 0.76 ± 0.15 0.54 ± 0.08 bn110903009 5.78E-06 ± 2.70E-08 8.42 ± 0.93 6.65 ± 0.44 5.53 ± 0.20 bn110903111 1.89E-05 ± 4.20E-08 3.85 ± 0.58 3.27 ± 0.27 2.57 ± 0.12 bn110904124 6.26E-06 ± 3.69E-08 4.20 ± 0.65 3.15 ± 0.29 2.40 ± 0.13 bn110904163 1.86E-06 ± 1.33E-08 2.27 ± 0.42 1.81 ± 0.19 1.25 ± 0.09 bn110904531 1.14E-06 ± 2.79E-08 2.13 ± 0.50 1.55 ± 0.24 1.18 ± 0.11 bn110906302 2.41E-06 ± 2.15E-08 3.37 ± 0.57 2.47 ± 0.27 2.14 ± 0.13

– 205 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn110909116 4.65E-06 ± 1.10E-07 12.33 ± 2.60 11.15 ± 1.43 8.61 ± 0.74 bn110911071 2.88E-07 ± 3.30E-08 2.37 ± 0.82 1.41 ± 0.39 0.84 ± 0.17 bn110916016 2.17E-07 ± 3.27E-08 1.65 ± 0.46 1.27 ± 0.21 0.81 ± 0.09 bn110919634 1.42E-05 ± 9.80E-08 6.53 ± 0.84 5.84 ± 0.35 5.20 ± 0.17 bn110920338 1.57E-06 ± 1.14E-08 4.12 ± 0.64 2.94 ± 0.27 1.82 ± 0.11 bn110920546 9.07E-05 ± 1.23E-07 9.25 ± 0.86 8.22 ± 0.43 7.73 ± 0.22 bn110921444 3.48E-06 ± 7.41E-08 1.38 ± 0.40 0.95 ± 0.16 0.68 ± 0.07 bn110921577 1.89E-06 ± 2.37E-08 1.72 ± 0.51 1.21 ± 0.25 0.90 ± 0.12 bn110921912 1.46E-05 ± 4.16E-08 19.41 ± 1.21 16.92 ± 0.55 14.72 ± 0.28 bn110923835 2.20E-06 ± 4.27E-08 2.37 ± 0.49 1.67 ± 0.22 1.18 ± 0.09 bn110926107 6.42E-06 ± 3.83E-08 3.89 ± 0.60 2.60 ± 0.26 2.18 ± 0.12 bn110928180 8.23E-06 ± 4.71E-08 3.70 ± 0.55 3.01 ± 0.25 2.37 ± 0.11 bn110929187 1.35E-06 ± 1.08E-08 3.67 ± 0.54 2.97 ± 0.26 2.79 ± 0.13 bn110930564 3.38E-06 ± 6.82E-08 2.50 ± 0.66 1.28 ± 0.29 1.10 ± 0.14 bn111001804 6.26E-08 ± 6.73E-09 2.02 ± 0.46 1.45 ± 0.19 0.42 ± 0.08 bn111003465 1.21E-05 ± 3.28E-08 10.96 ± 0.70 10.71 ± 0.36 9.40 ± 0.17 bn111005398 1.17E-06 ± 1.66E-08 1.35 ± 0.36 0.78 ± 0.16 0.48 ± 0.06 bn111008992 1.65E-06 ± 1.45E-08 0.96 ± 0.33 0.66 ± 0.14 0.45 ± 0.06 bn111009282 8.92E-06 ± 5.65E-08 8.57 ± 0.81 7.23 ± 0.38 6.26 ± 0.18 bn111010237 4.99E-06 ± 6.75E-08 1.78 ± 0.49 1.02 ± 0.20 0.79 ± 0.10 bn111010660 4.80E-07 ± 1.85E-08 1.61 ± 0.44 1.30 ± 0.19 0.98 ± 0.09 bn111010709 6.48E-06 ± 2.69E-08 3.02 ± 0.48 1.85 ± 0.23 1.57 ± 0.10 bn111010899 5.89E-07 ± 3.06E-08 1.47 ± 0.43 1.06 ± 0.20 0.76 ± 0.10 bn111011094 2.32E-07 ± 1.04E-08 8.61 ± 0.69 4.07 ± 0.24 1.11 ± 0.07 bn111012456 1.01E-05 ± 4.23E-08 6.83 ± 0.95 6.45 ± 0.47 5.37 ± 0.22 bn111012811 2.08E-06 ± 1.74E-08 12.76 ± 0.77 11.35 ± 0.37 7.13 ± 0.15 bn111015427 1.32E-05 ± 2.09E-07 5.80 ± 0.91 4.89 ± 0.41 4.24 ± 0.19 bn111017657 9.23E-06 ± 2.95E-08 9.41 ± 0.72 8.56 ± 0.33 8.00 ± 0.16 bn111018595 6.84E-07 ± 3.08E-08 1.88 ± 0.45 1.40 ± 0.23 1.17 ± 0.11 bn111018785 9.38E-07 ± 1.79E-08 1.25 ± 0.48 0.88 ± 0.21 0.61 ± 0.11 bn111022854 9.90E-08 ± 7.40E-09 3.78 ± 0.54 2.29 ± 0.23 0.62 ± 0.08 bn111024722 8.57E-06 ± 7.28E-08 6.12 ± 0.66 5.70 ± 0.34 4.06 ± 0.15

– 206 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn111024896 1.23E-07 ± 8.73E-09 3.16 ± 0.78 1.60 ± 0.25 0.60 ± 0.09 bn111025078 1.58E-06 ± 1.63E-08 1.81 ± 0.58 0.76 ± 0.18 0.51 ± 0.07 bn111103441 1.92E-06 ± 3.76E-08 3.86 ± 0.61 3.26 ± 0.30 2.37 ± 0.13 bn111103948 1.69E-07 ± 2.79E-08 4.32 ± 0.62 3.27 ± 0.28 1.28 ± 0.12 bn111105457 9.71E-07 ± 2.48E-08 1.57 ± 0.42 0.91 ± 0.17 0.62 ± 0.07 bn111107035 5.00E-07 ± 1.98E-08 1.28 ± 0.57 0.97 ± 0.24 0.56 ± 0.09 bn111107076 5.68E-06 ± 3.28E-08 2.30 ± 0.44 1.72 ± 0.21 1.49 ± 0.10 bn111109453 1.75E-07 ± 1.75E-08 0.95 ± 0.45 0.65 ± 0.15 0.46 ± 0.06 bn111109873 4.28E-06 ± 3.48E-07 8.81 ± 2.49 6.22 ± 1.07 4.41 ± 0.50 bn111112908 2.64E-07 ± 1.11E-08 7.93 ± 0.68 4.85 ± 0.28 1.33 ± 0.08 bn111113410 1.55E-06 ± 3.83E-08 2.90 ± 0.45 2.64 ± 0.22 2.15 ± 0.11 bn111114233 6.04E-07 ± 1.42E-08 1.24 ± 0.30 1.07 ± 0.16 0.74 ± 0.07 bn111117510 3.40E-07 ± 1.41E-08 6.22 ± 0.71 3.53 ± 0.29 1.64 ± 0.10 bn111117526 7.89E-07 ± 1.39E-08 1.49 ± 0.41 0.61 ± 0.13 0.31 ± 0.05 bn111120556 3.19E-06 ± 3.85E-08 2.06 ± 0.48 1.72 ± 0.23 1.37 ± 0.11 bn111124308 3.43E-07 ± 1.20E-08 0.96 ± 0.31 0.50 ± 0.13 0.39 ± 0.06 bn111127810 4.31E-06 ± 4.30E-08 5.66 ± 0.76 5.29 ± 0.36 4.69 ± 0.17 bn111201599 9.39E-07 ± 3.78E-08 1.51 ± 0.40 0.90 ± 0.19 0.55 ± 0.08 bn111203054 2.61E-06 ± 2.22E-08 3.84 ± 0.54 3.00 ± 0.24 2.38 ± 0.11 bn111203609 3.64E-07 ± 2.37E-08 1.50 ± 0.39 0.73 ± 0.17 0.54 ± 0.08 bn111207512 1.16E-07 ± 1.20E-08 1.90 ± 0.45 0.89 ± 0.19 0.55 ± 0.09 bn111208353 2.06E-06 ± 2.49E-08 1.40 ± 0.42 0.97 ± 0.19 0.79 ± 0.09 bn111216389 2.56E-05 ± 6.16E-08 9.12 ± 1.00 6.90 ± 0.47 5.03 ± 0.21 bn111220486 2.83E-05 ± 1.41E-07 19.40 ± 1.02 16.83 ± 0.47 12.34 ± 0.20 bn111221739 1.10E-06 ± 3.01E-08 10.64 ± 1.35 9.36 ± 0.63 4.22 ± 0.20 bn111222619 1.67E-06 ± 2.07E-08 30.66 ± 2.04 22.51 ± 0.92 7.07 ± 0.27 bn111226795 7.20E-06 ± 7.12E-08 2.24 ± 0.40 1.93 ± 0.18 1.51 ± 0.09 bn111228453 9.17E-07 ± 2.51E-08 4.10 ± 0.52 3.73 ± 0.25 3.26 ± 0.12 bn111228657 7.45E-06 ± 3.10E-08 7.30 ± 0.68 6.37 ± 0.32 4.88 ± 0.15 bn111230683 1.47E-06 ± 2.68E-08 2.98 ± 0.86 2.10 ± 0.34 1.32 ± 0.14 bn111230819 2.18E-06 ± 2.36E-08 4.10 ± 0.57 3.58 ± 0.26 2.46 ± 0.12 bn120101354 8.76E-08 ± 7.66E-09 4.61 ± 0.54 2.11 ± 0.22 0.55 ± 0.09

– 207 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120102095 6.77E-06 ± 2.32E-08 9.18 ± 0.87 8.49 ± 0.39 7.74 ± 0.19 bn120102416 1.46E-06 ± 3.09E-08 2.33 ± 0.52 1.48 ± 0.22 1.28 ± 0.09 bn120105584 7.70E-07 ± 1.55E-08 1.42 ± 0.36 1.06 ± 0.18 0.65 ± 0.08 bn120107384 3.90E-06 ± 2.50E-08 4.20 ± 0.55 3.51 ± 0.25 2.74 ± 0.11 bn120109824 1.01E-06 ± 2.55E-08 1.68 ± 0.72 0.81 ± 0.25 0.57 ± 0.11 bn120111051 2.36E-06 ± 3.08E-08 1.60 ± 0.49 0.84 ± 0.17 0.53 ± 0.08 bn120114433 8.65E-08 ± 1.63E-08 1.56 ± 0.41 0.64 ± 0.15 0.36 ± 0.06 bn120114681 1.30E-06 ± 2.12E-08 1.47 ± 0.46 1.01 ± 0.22 0.58 ± 0.08 bn120118709 1.27E-06 ± 2.37E-08 1.65 ± 0.53 0.90 ± 0.23 0.72 ± 0.10 bn120118898 8.87E-07 ± 1.87E-08 7.40 ± 0.72 6.63 ± 0.32 2.98 ± 0.12 bn120119170 2.22E-05 ± 7.25E-08 8.75 ± 0.77 8.05 ± 0.39 7.39 ± 0.19 bn120119229 2.79E-06 ± 1.86E-08 2.68 ± 0.60 2.25 ± 0.22 1.69 ± 0.10 bn120119354 1.49E-06 ± 2.47E-08 3.01 ± 0.52 2.16 ± 0.25 1.48 ± 0.10 bn120120432 8.15E-07 ± 1.81E-08 1.40 ± 0.42 0.64 ± 0.14 0.35 ± 0.06 bn120121101 1.13E-06 ± 1.65E-08 1.53 ± 0.38 1.15 ± 0.17 0.79 ± 0.08 bn120121251 6.64E-06 ± 3.54E-08 3.58 ± 0.55 3.16 ± 0.28 2.55 ± 0.12 bn120122300 1.55E-06 ± 2.62E-08 2.08 ± 0.56 1.39 ± 0.22 0.91 ± 0.09 bn120129312 6.39E-08 ± 9.14E-09 1.01 ± 0.31 0.72 ± 0.15 0.29 ± 0.07 bn120129580 2.94E-05 ± 3.92E-08 112.97 ± 2.99 110.18 ± 1.47 81.16 ± 0.63 bn120130699 3.55E-06 ± 7.61E-08 4.72 ± 0.79 4.04 ± 0.37 2.81 ± 0.17 bn120130906 3.27E-07 ± 1.78E-08 1.30 ± 0.29 0.88 ± 0.15 0.63 ± 0.06 bn120130938 6.12E-06 ± 9.33E-08 4.42 ± 0.78 3.45 ± 0.35 2.76 ± 0.16 bn120203812 6.26E-07 ± 1.47E-08 2.80 ± 0.74 1.37 ± 0.24 0.88 ± 0.11 bn120204054 5.26E-05 ± 4.41E-08 16.64 ± 0.86 15.98 ± 0.42 15.43 ± 0.21 bn120205285 1.37E-07 ± 1.24E-08 1.48 ± 0.40 1.26 ± 0.19 0.67 ± 0.09 bn120206949 3.40E-06 ± 3.46E-08 13.20 ± 1.14 11.58 ± 0.52 9.86 ± 0.24 bn120210650 3.28E-07 ± 8.69E-09 3.80 ± 0.44 3.09 ± 0.20 1.71 ± 0.07 bn120212353 3.47E-08 ± 6.64E-09 3.86 ± 0.68 1.87 ± 0.25 0.72 ± 0.10 bn120212383 5.80E-07 ± 1.38E-08 1.58 ± 0.44 0.99 ± 0.20 0.79 ± 0.11 bn120213606 1.60E-06 ± 2.51E-08 4.93 ± 0.56 3.59 ± 0.26 2.78 ± 0.12 bn120217808 8.23E-07 ± 3.78E-08 3.48 ± 0.73 3.36 ± 0.34 2.58 ± 0.15 bn120217904 2.61E-06 ± 2.12E-08 23.54 ± 1.21 20.75 ± 0.58 10.44 ± 0.21

– 208 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120218276 6.31E-06 ± 3.95E-08 1.58 ± 0.45 1.04 ± 0.19 0.80 ± 0.09 bn120219563 3.27E-07 ± 9.87E-09 0.78 ± 0.25 0.72 ± 0.12 0.47 ± 0.06 bn120220210 6.99E-07 ± 1.35E-08 1.61 ± 0.41 0.60 ± 0.13 0.42 ± 0.07 bn120222021 1.15E-06 ± 1.19E-08 10.91 ± 0.79 9.66 ± 0.37 6.47 ± 0.16 bn120222119 1.38E-06 ± 3.54E-08 2.29 ± 0.56 1.16 ± 0.24 0.86 ± 0.12 bn120223933 2.11E-06 ± 4.48E-08 2.59 ± 0.57 2.40 ± 0.23 2.08 ± 0.12 bn120224282 4.63E-06 ± 1.09E-07 2.74 ± 0.55 1.93 ± 0.25 1.46 ± 0.12 bn120224898 1.43E-06 ± 3.24E-08 1.41 ± 0.36 0.89 ± 0.15 0.69 ± 0.07 bn120226447 3.20E-06 ± 4.11E-08 4.65 ± 1.22 3.27 ± 0.47 2.31 ± 0.19 bn120226871 2.72E-05 ± 4.78E-08 6.56 ± 0.68 6.05 ± 0.33 5.04 ± 0.16 bn120227391 1.91E-06 ± 4.64E-08 3.43 ± 0.92 1.82 ± 0.30 0.96 ± 0.12 bn120227725 1.37E-05 ± 5.18E-08 11.19 ± 1.43 9.46 ± 0.70 8.06 ± 0.33 bn120302080 1.29E-06 ± 2.77E-08 0.91 ± 0.35 0.71 ± 0.15 0.51 ± 0.07 bn120302722 6.00E-08 ± 8.66E-09 1.98 ± 0.45 1.17 ± 0.17 0.50 ± 0.07 bn120304061 2.08E-06 ± 1.10E-08 3.78 ± 0.30 3.78 ± 0.15 3.25 ± 0.09 bn120304248 3.35E-06 ± 2.41E-08 12.78 ± 0.99 8.93 ± 0.52 5.30 ± 0.21 bn120308588 3.24E-06 ± 3.37E-08 8.77 ± 1.20 7.99 ± 0.57 6.21 ± 0.24 bn120312671 4.75E-07 ± 1.53E-08 1.17 ± 0.36 0.69 ± 0.19 0.47 ± 0.07 bn120314412 9.24E-08 ± 1.76E-08 0.97 ± 0.31 0.84 ± 0.13 0.45 ± 0.05 bn120316008 7.58E-06 ± 1.65E-08 6.26 ± 0.89 5.82 ± 0.43 3.52 ± 0.17 bn120319983 1.30E-06 ± 2.06E-08 1.23 ± 0.40 0.95 ± 0.16 0.51 ± 0.06 bn120323162 9.31E-07 ± 9.99E-09 4.60 ± 0.60 3.42 ± 0.27 2.43 ± 0.12 bn120323507 5.41E-06 ± 9.93E-09 180.72 ± 3.05 101.49 ± 1.15 29.94 ± 0.33 bn120326056 1.55E-06 ± 2.51E-08 2.86 ± 0.44 2.09 ± 0.21 1.84 ± 0.10 bn120327418 7.30E-08 ± 2.02E-08 3.48 ± 0.81 1.59 ± 0.25 0.50 ± 0.09 bn120328268 4.09E-05 ± 9.20E-08 19.88 ± 0.91 18.62 ± 0.45 16.98 ± 0.22 bn120331055 2.53E-07 ± 2.63E-08 6.05 ± 0.87 2.24 ± 0.30 0.52 ± 0.11 bn120402669 1.33E-06 ± 1.26E-08 3.04 ± 0.36 2.76 ± 0.30 2.46 ± 0.13 bn120403857 1.25E-07 ± 1.08E-08 0.60 ± 0.25 0.55 ± 0.12 0.40 ± 0.06 bn120410585 1.51E-07 ± 1.12E-08 4.61 ± 0.56 2.86 ± 0.26 0.77 ± 0.10 bn120411925 7.26E-07 ± 1.44E-08 1.13 ± 0.34 0.69 ± 0.12 0.42 ± 0.05 bn120412055 6.81E-07 ± 4.89E-08 1.77 ± 0.50 1.44 ± 0.24 1.04 ± 0.11

– 209 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120412920 3.91E-06 ± 2.91E-08 3.67 ± 0.69 3.11 ± 0.33 2.38 ± 0.15 bn120415076 1.47E-06 ± 2.90E-08 2.69 ± 0.48 2.33 ± 0.22 1.92 ± 0.10 bn120415891 7.17E-08 ± 4.16E-09 1.59 ± 0.31 1.23 ± 0.14 0.53 ± 0.06 bn120415958 1.10E-06 ± 3.03E-08 2.51 ± 0.65 1.60 ± 0.35 1.16 ± 0.15 bn120420249 1.63E-06 ± 3.39E-08 2.10 ± 0.53 1.56 ± 0.25 1.20 ± 0.11 bn120420858 2.33E-05 ± 1.19E-07 3.49 ± 0.67 2.49 ± 0.31 2.10 ± 0.15 bn120426090 1.30E-05 ± 4.21E-08 39.97 ± 1.72 37.76 ± 0.83 34.98 ± 0.40 bn120426585 2.13E-06 ± 2.16E-08 1.94 ± 0.42 1.08 ± 0.21 0.70 ± 0.07 bn120427054 5.17E-06 ± 3.19E-08 10.01 ± 0.85 9.42 ± 0.41 8.67 ± 0.20 bn120427153 3.75E-07 ± 2.05E-08 0.80 ± 0.39 0.67 ± 0.15 0.41 ± 0.07 bn120429003 1.59E-07 ± 1.16E-08 2.58 ± 0.51 1.40 ± 0.18 0.87 ± 0.08 bn120429484 1.11E-06 ± 9.04E-09 1.87 ± 0.44 1.55 ± 0.19 1.26 ± 0.09 bn120430980 3.19E-07 ± 1.06E-08 0.76 ± 0.44 0.52 ± 0.18 0.40 ± 0.07 bn120504468 1.66E-06 ± 1.42E-08 1.01 ± 0.38 0.72 ± 0.17 0.53 ± 0.07 bn120504945 8.06E-07 ± 1.45E-08 2.48 ± 0.66 1.67 ± 0.27 1.22 ± 0.12 bn120506128 1.57E-07 ± 1.36E-08 1.22 ± 0.39 0.69 ± 0.16 0.58 ± 0.07 bn120509619 9.65E-08 ± 8.39E-09 1.79 ± 0.48 1.21 ± 0.18 0.54 ± 0.07 bn120510900 3.01E-06 ± 3.21E-08 1.43 ± 0.49 0.92 ± 0.21 0.52 ± 0.08 bn120511638 5.66E-06 ± 5.26E-08 3.83 ± 0.81 2.90 ± 0.36 2.21 ± 0.17 bn120512112 6.69E-06 ± 3.99E-08 4.01 ± 0.41 3.77 ± 0.22 3.53 ± 0.11 bn120513531 6.68E-07 ± 2.00E-08 1.30 ± 0.40 1.14 ± 0.20 0.75 ± 0.09 bn120519721 7.68E-07 ± 1.41E-08 6.11 ± 0.84 4.60 ± 0.41 3.12 ± 0.17 bn120520949 4.41E-07 ± 1.41E-08 1.70 ± 0.35 1.32 ± 0.18 1.06 ± 0.09 bn120521380 1.79E-06 ± 1.91E-08 1.39 ± 0.38 0.77 ± 0.17 0.52 ± 0.08 bn120522361 5.02E-06 ± 2.84E-08 5.49 ± 0.79 4.76 ± 0.38 3.95 ± 0.17 bn120524134 1.27E-07 ± 7.96E-09 5.49 ± 0.78 2.84 ± 0.33 0.91 ± 0.10 bn120526303 4.66E-05 ± 1.19E-07 12.63 ± 2.07 7.99 ± 0.93 6.36 ± 0.49 bn120528442 2.12E-06 ± 2.46E-08 2.87 ± 0.57 2.25 ± 0.27 1.84 ± 0.12 bn120530121 4.10E-06 ± 2.51E-08 2.74 ± 0.55 2.19 ± 0.25 1.56 ± 0.12 bn120531393 5.16E-07 ± 1.01E-08 1.00 ± 0.38 0.70 ± 0.16 0.47 ± 0.07 bn120603439 3.05E-07 ± 1.54E-08 6.48 ± 0.94 4.91 ± 0.37 1.60 ± 0.11 bn120604220 7.14E-07 ± 2.70E-08 3.45 ± 0.56 2.29 ± 0.23 0.99 ± 0.09

– 210 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120604343 8.62E-07 ± 3.81E-08 1.16 ± 0.38 1.14 ± 0.20 0.69 ± 0.08 bn120605453 1.71E-06 ± 3.08E-08 5.94 ± 0.71 4.56 ± 0.32 3.74 ± 0.15 bn120608489 2.95E-07 ± 1.09E-08 4.18 ± 0.65 3.77 ± 0.31 1.40 ± 0.10 bn120608777 1.77E-06 ± 2.40E-08 2.37 ± 0.54 1.51 ± 0.23 1.13 ± 0.09 bn120609580 2.60E-07 ± 1.33E-08 1.73 ± 0.44 1.61 ± 0.22 1.15 ± 0.09 bn120611108 2.29E-06 ± 2.73E-08 3.60 ± 0.52 2.98 ± 0.25 1.45 ± 0.09 bn120612680 1.10E-06 ± 1.55E-08 1.36 ± 0.38 0.61 ± 0.18 0.48 ± 0.08 bn120612687 2.50E-07 ± 1.18E-08 5.83 ± 0.82 3.95 ± 0.35 1.14 ± 0.10 bn120616630 6.42E-08 ± 6.03E-09 3.25 ± 0.80 1.07 ± 0.23 0.28 ± 0.08 bn120618128 3.79E-06 ± 3.79E-08 3.25 ± 0.51 2.92 ± 0.24 2.63 ± 0.38 bn120618919 1.95E-06 ± 3.16E-08 4.67 ± 1.00 3.17 ± 0.41 1.75 ± 0.18 bn120619884 2.24E-07 ± 1.69E-08 2.72 ± 0.61 1.97 ± 0.23 1.00 ± 0.09 bn120624309 2.55E-06 ± 4.19E-08 48.93 ± 1.31 33.11 ± 0.63 10.60 ± 0.20 bn120624933 7.64E-05 ± 1.09E-07 9.99 ± 0.71 9.31 ± 0.35 8.28 ± 0.17 bn120625119 6.10E-06 ± 2.00E-08 10.74 ± 1.04 9.94 ± 0.49 9.55 ± 0.23 bn120629565 3.24E-08 ± 6.57E-09 0.83 ± 0.21 0.51 ± 0.10 0.24 ± 0.05 bn120701654 4.91E-08 ± 2.92E-08 1.56 ± 0.50 1.05 ± 0.24 0.41 ± 0.11 bn120702891 9.95E-07 ± 3.40E-08 1.16 ± 0.41 0.66 ± 0.14 0.44 ± 0.06 bn120703417 5.49E-06 ± 2.78E-08 3.58 ± 0.56 2.90 ± 0.25 2.55 ± 0.12 bn120703498 1.54E-06 ± 3.29E-08 1.90 ± 0.54 1.22 ± 0.21 0.73 ± 0.08 bn120703726 4.31E-06 ± 5.25E-08 11.92 ± 0.73 10.30 ± 0.36 8.60 ± 0.17 bn120707800 5.21E-05 ± 3.38E-07 28.34 ± 2.53 24.61 ± 1.23 22.60 ± 0.59 bn120709883 6.30E-06 ± 2.11E-08 10.91 ± 0.77 8.50 ± 0.36 5.00 ± 0.16 bn120710100 2.71E-06 ± 1.10E-08 1.99 ± 0.44 1.17 ± 0.17 0.90 ± 0.08 bn120711115 6.65E-05 ± 7.69E-08 19.05 ± 1.68 14.42 ± 0.64 12.19 ± 0.28 bn120711446 1.00E-06 ± 1.18E-08 0.73 ± 0.34 0.54 ± 0.10 0.31 ± 0.05 bn120712571 2.61E-06 ± 2.62E-08 2.49 ± 0.41 1.75 ± 0.18 1.61 ± 0.09 bn120713226 5.97E-07 ± 5.92E-08 1.04 ± 0.41 0.71 ± 0.17 0.52 ± 0.08 bn120715066 1.13E-06 ± 1.95E-08 2.14 ± 0.60 1.28 ± 0.20 0.75 ± 0.07 bn120716577 2.79E-06 ± 6.16E-08 2.03 ± 0.60 1.62 ± 0.24 1.43 ± 0.12 bn120716712 8.29E-06 ± 2.19E-08 7.10 ± 0.74 6.39 ± 0.35 3.30 ± 0.13 bn120719146 8.12E-06 ± 4.02E-08 3.31 ± 0.58 3.05 ± 0.28 2.25 ± 0.12

– 211 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120727354 6.62E-08 ± 1.20E-08 0.73 ± 0.21 0.42 ± 0.10 0.27 ± 0.05 bn120727681 5.29E-06 ± 3.75E-08 6.69 ± 0.59 6.18 ± 0.29 5.70 ± 0.14 bn120728434 6.99E-05 ± 1.31E-06 17.70 ± 1.22 17.28 ± 0.60 15.98 ± 0.29 bn120728934 1.92E-06 ± 2.24E-08 3.32 ± 0.76 1.32 ± 0.23 0.80 ± 0.10 bn120729456 2.67E-06 ± 2.89E-08 2.39 ± 0.49 2.03 ± 0.22 1.80 ± 0.11 bn120801920 1.82E-05 ± 1.45E-07 6.91 ± 1.76 4.55 ± 0.79 3.78 ± 0.38 bn120805706 9.64E-08 ± 1.13E-08 0.76 ± 0.44 0.63 ± 0.15 0.50 ± 0.07 bn120806007 2.21E-06 ± 1.97E-08 3.23 ± 0.47 2.60 ± 0.21 2.37 ± 0.10 bn120811014 4.66E-07 ± 1.04E-08 8.16 ± 0.95 4.97 ± 0.40 1.82 ± 0.13 bn120811649 1.61E-06 ± 1.19E-07 3.34 ± 0.82 3.00 ± 0.40 2.17 ± 0.19 bn120814201 2.28E-07 ± 1.97E-08 3.57 ± 0.94 2.16 ± 0.35 1.44 ± 0.14 bn120814803 7.19E-08 ± 1.98E-08 2.81 ± 0.46 1.56 ± 0.19 0.36 ± 0.07 bn120817057 5.71E-07 ± 1.46E-08 0.99 ± 0.29 0.59 ± 0.12 0.29 ± 0.06 bn120817168 5.00E-07 ± 5.93E-09 19.28 ± 1.44 8.08 ± 0.47 2.19 ± 0.13 bn120819048 7.43E-07 ± 1.74E-08 1.59 ± 0.43 1.19 ± 0.18 0.71 ± 0.07 bn120820585 3.85E-06 ± 1.48E-08 1.16 ± 0.26 0.84 ± 0.12 0.67 ± 0.06 bn120822628 6.42E-08 ± 7.56E-09 0.82 ± 0.23 0.51 ± 0.11 0.32 ± 0.05 bn120824594 3.22E-06 ± 2.19E-08 1.56 ± 0.43 0.66 ± 0.14 0.42 ± 0.06 bn120827216 1.72E-06 ± 5.02E-08 4.48 ± 0.86 3.27 ± 0.34 2.67 ± 0.16 bn120830212 3.97E-06 ± 1.17E-07 6.94 ± 1.00 6.21 ± 0.47 3.76 ± 0.21 bn120830297 7.92E-07 ± 1.60E-08 5.06 ± 0.73 4.63 ± 0.34 3.14 ± 0.15 bn120830702 3.32E-06 ± 1.77E-08 2.69 ± 0.43 2.50 ± 0.21 1.70 ± 0.09 bn120831901 1.24E-07 ± 1.54E-08 5.33 ± 0.77 2.29 ± 0.25 0.69 ± 0.08 bn120905657 1.09E-05 ± 3.15E-07 1.71 ± 0.35 1.34 ± 0.18 1.15 ± 0.08 bn120907017 5.25E-07 ± 2.49E-08 3.67 ± 0.91 2.51 ± 0.41 1.65 ± 0.17 bn120908873 8.00E-06 ± 4.63E-08 4.13 ± 0.77 2.74 ± 0.36 2.10 ± 0.14 bn120908938 3.30E-06 ± 6.95E-08 2.22 ± 0.57 1.29 ± 0.23 1.03 ± 0.11 bn120909070 5.17E-06 ± 7.87E-08 2.29 ± 0.51 2.03 ± 0.26 1.09 ± 0.09 bn120911298 1.22E-06 ± 2.36E-08 1.85 ± 0.51 1.41 ± 0.24 1.08 ± 0.11 bn120913846 7.87E-07 ± 1.58E-08 0.99 ± 0.22 0.83 ± 0.14 0.64 ± 0.06 bn120913997 1.09E-05 ± 3.28E-08 2.80 ± 0.48 2.35 ± 0.22 1.90 ± 0.09 bn120914144 4.21E-07 ± 1.90E-08 2.11 ± 0.51 1.60 ± 0.22 1.06 ± 0.10

– 212 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn120915000 1.89E-07 ± 1.31E-08 3.05 ± 0.62 2.04 ± 0.26 0.89 ± 0.09 bn120915474 2.05E-07 ± 1.20E-08 1.16 ± 0.32 0.50 ± 0.11 0.32 ± 0.05 bn120916085 4.02E-08 ± 5.44E-09 2.53 ± 0.40 1.37 ± 0.19 0.59 ± 0.08 bn120916173 7.24E-06 ± 2.58E-08 1.33 ± 0.47 5.78 ± 0.40 5.09 ± 0.16 bn120919052 1.08E-05 ± 2.05E-08 7.36 ± 0.70 6.71 ± 0.34 4.62 ± 0.15 bn120919309 9.51E-06 ± 2.73E-08 13.78 ± 0.75 13.26 ± 0.37 11.89 ± 0.18 bn120919816 6.06E-07 ± 9.74E-09 1.77 ± 0.43 1.37 ± 0.20 0.76 ± 0.08 bn120920003 5.19E-07 ± 1.61E-08 1.06 ± 0.34 0.50 ± 0.13 0.28 ± 0.06 bn120921877 1.62E-06 ± 1.70E-08 7.30 ± 0.83 6.82 ± 0.40 5.31 ± 0.19 bn120922939 3.92E-06 ± 1.12E-07 1.13 ± 0.41 0.99 ± 0.21 0.82 ± 0.10 bn120926335 1.19E-06 ± 2.50E-08 7.83 ± 0.63 5.79 ± 0.27 2.91 ± 0.11 bn120926426 2.60E-06 ± 4.75E-08 2.97 ± 0.73 2.13 ± 0.30 1.30 ± 0.11 bn120926753 1.06E-07 ± 1.35E-08 1.33 ± 0.39 0.50 ± 0.14 0.32 ± 0.06 bn121004211 2.23E-07 ± 8.22E-09 2.50 ± 0.58 1.61 ± 0.24 0.96 ± 0.09 bn121005030 1.81E-06 ± 3.00E-08 2.77 ± 0.86 1.11 ± 0.25 0.54 ± 0.08 bn121005340 2.92E-06 ± 2.94E-08 1.92 ± 0.45 0.87 ± 0.14 0.68 ± 0.06 bn121008424 2.39E-07 ± 7.76E-09 1.96 ± 0.50 1.56 ± 0.22 1.01 ± 0.10 bn121011469 2.33E-06 ± 1.82E-08 1.69 ± 0.40 0.86 ± 0.13 0.64 ± 0.06 bn121012724 4.87E-07 ± 5.12E-09 6.29 ± 0.68 5.33 ± 0.31 2.14 ± 0.10 bn121014638 8.42E-08 ± 1.29E-08 1.59 ± 0.37 1.20 ± 0.16 0.51 ± 0.06 bn121019233 3.19E-07 ± 4.63E-08 2.22 ± 0.52 0.74 ± 0.16 0.30 ± 0.05 bn121023322 4.44E-07 ± 2.35E-08 5.35 ± 0.72 4.77 ± 0.38 2.47 ± 0.15 bn121027038 4.40E-06 ± 3.53E-08 1.51 ± 0.64 1.32 ± 0.29 0.97 ± 0.13 bn121028280 5.75E-07 ± 1.30E-08 1.73 ± 0.38 1.11 ± 0.17 0.76 ± 0.08 bn121029350 5.12E-06 ± 3.25E-08 12.74 ± 0.71 10.54 ± 0.34 7.42 ± 0.15 bn121031949 8.03E-06 ± 7.40E-08 2.67 ± 0.55 2.11 ± 0.26 1.81 ± 0.13 bn121102064 4.09E-07 ± 3.72E-08 0.79 ± 0.29 0.61 ± 0.14 0.48 ± 0.07 bn121104627 2.56E-06 ± 6.33E-08 1.69 ± 0.44 1.17 ± 0.19 0.94 ± 0.09 bn121109338 2.89E-06 ± 3.39E-08 3.13 ± 0.67 2.23 ± 0.28 1.95 ± 0.14 bn121112806 1.25E-07 ± 1.82E-08 2.29 ± 0.49 0.95 ± 0.14 0.62 ± 0.07 bn121113544 1.57E-05 ± 5.13E-08 5.41 ± 0.76 4.09 ± 0.35 3.14 ± 0.16 bn121116459 1.71E-07 ± 7.43E-09 2.90 ± 1.01 1.55 ± 0.31 0.95 ± 0.12

– 213 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn121117018 5.13E-06 ± 3.64E-08 2.10 ± 0.40 1.74 ± 0.18 1.31 ± 0.08 bn121118576 3.91E-06 ± 1.92E-08 17.23 ± 0.91 12.11 ± 0.39 4.96 ± 0.14 bn121119579 4.79E-07 ± 1.31E-08 4.85 ± 0.67 3.49 ± 0.29 1.84 ± 0.12 bn121122564 3.89E-07 ± 1.02E-08 1.37 ± 0.39 1.26 ± 0.18 0.93 ± 0.09 bn121122870 5.42E-06 ± 3.16E-08 3.29 ± 0.60 3.13 ± 0.31 1.92 ± 0.12 bn121122885 2.48E-05 ± 6.64E-08 22.18 ± 2.82 20.18 ± 1.43 18.90 ± 0.68 bn121123421 1.25E-05 ± 4.10E-07 2.53 ± 0.52 2.20 ± 0.25 1.93 ± 0.12 bn121123442 7.97E-06 ± 5.68E-08 4.06 ± 0.64 2.92 ± 0.26 2.29 ± 0.11 bn121124606 2.49E-08 ± 5.55E-09 1.58 ± 0.36 0.70 ± 0.13 0.20 ± 0.05 bn121125356 3.74E-06 ± 3.44E-08 3.05 ± 0.49 2.30 ± 0.21 1.62 ± 0.09 bn121125469 4.80E-07 ± 1.49E-08 1.09 ± 0.33 0.84 ± 0.13 0.60 ± 0.06 bn121127914 5.58E-07 ± 1.98E-08 9.86 ± 0.90 7.26 ± 0.43 2.32 ± 0.14 bn121128212 5.08E-06 ± 5.83E-08 10.82 ± 1.05 9.22 ± 0.49 7.23 ± 0.22 bn121202181 1.17E-06 ± 3.32E-08 1.15 ± 0.33 0.73 ± 0.18 0.48 ± 0.07 bn121205507 7.04E-08 ± 4.06E-09 0.90 ± 0.40 0.58 ± 0.18 0.26 ± 0.06 bn121210081 1.06E-06 ± 3.29E-08 1.56 ± 0.51 1.48 ± 0.26 0.82 ± 0.12 bn121211574 3.69E-07 ± 2.19E-08 1.39 ± 0.35 0.78 ± 0.16 0.58 ± 0.06 bn121211695 7.57E-07 ± 1.89E-08 2.11 ± 0.41 1.70 ± 0.19 1.43 ± 0.09 bn121216419 2.17E-07 ± 1.39E-08 1.42 ± 0.54 1.05 ± 0.22 0.53 ± 0.08 bn121217313 3.67E-06 ± 3.58E-08 2.53 ± 0.71 1.43 ± 0.27 0.94 ± 0.11 bn121220311 2.81E-07 ± 1.61E-08 0.67 ± 0.23 0.40 ± 0.11 0.30 ± 0.05 bn121221916 2.65E-06 ± 2.53E-08 1.83 ± 0.40 1.12 ± 0.18 0.93 ± 0.08 bn121223300 4.85E-06 ± 1.10E-08 5.56 ± 0.52 4.98 ± 0.25 4.61 ± 0.12 bn121225417 3.53E-05 ± 9.93E-08 14.02 ± 0.98 12.71 ± 0.47 11.08 ± 0.22 bn121229533 2.13E-06 ± 1.90E-08 2.42 ± 0.51 1.66 ± 0.21 1.34 ± 0.10 bn121231445 1.54E-06 ± 2.93E-08 1.45 ± 0.48 0.94 ± 0.18 0.58 ± 0.08 bn130104721 3.17E-06 ± 3.00E-08 3.32 ± 0.50 2.82 ± 0.24 2.20 ± 0.11 bn130106829 9.85E-07 ± 2.27E-08 1.68 ± 0.42 1.17 ± 0.19 0.94 ± 0.08 bn130106995 7.71E-06 ± 3.25E-08 2.66 ± 0.68 2.23 ± 0.33 1.73 ± 0.14 bn130109206 1.40E-06 ± 3.52E-08 3.53 ± 0.46 2.95 ± 0.22 2.36 ± 0.11 bn130112286 1.52E-06 ± 2.39E-08 4.68 ± 0.58 4.07 ± 0.27 2.61 ± 0.11 bn130112353 5.49E-07 ± 1.55E-08 4.22 ± 0.60 3.20 ± 0.28 1.66 ± 0.10

– 214 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130114019 4.42E-07 ± 3.99E-08 1.36 ± 0.34 0.97 ± 0.17 0.74 ± 0.08 bn130115716 1.70E-06 ± 1.78E-08 2.61 ± 0.50 1.57 ± 0.21 1.11 ± 0.09 bn130116415 4.79E-07 ± 1.79E-08 2.38 ± 0.80 1.04 ± 0.25 0.39 ± 0.08 bn130117087 1.54E-06 ± 1.93E-08 0.96 ± 0.40 0.60 ± 0.13 0.40 ± 0.06 bn130118482 4.40E-07 ± 1.88E-08 0.80 ± 0.25 0.80 ± 0.13 0.36 ± 0.06 bn130121835 2.50E-05 ± 6.14E-08 15.72 ± 1.31 14.54 ± 0.66 11.57 ± 0.30 bn130123843 7.55E-07 ± 1.69E-08 1.78 ± 0.39 1.32 ± 0.19 0.94 ± 0.09 bn130127299 5.56E-07 ± 3.08E-08 1.04 ± 0.40 0.66 ± 0.14 0.41 ± 0.06 bn130127743 7.57E-08 ± 6.27E-09 4.85 ± 0.48 2.40 ± 0.23 0.52 ± 0.08 bn130131511 2.38E-05 ± 3.84E-08 4.91 ± 0.84 4.06 ± 0.35 3.44 ± 0.16 bn130204484 1.18E-07 ± 7.05E-09 4.15 ± 0.69 2.31 ± 0.25 0.60 ± 0.09 bn130206482 4.37E-06 ± 3.43E-08 8.31 ± 0.59 7.84 ± 0.29 6.98 ± 0.14 bn130206817 1.53E-06 ± 4.14E-08 1.82 ± 0.47 1.39 ± 0.21 0.73 ± 0.09 bn130208684 1.36E-06 ± 2.72E-08 1.85 ± 0.43 0.90 ± 0.16 0.60 ± 0.07 bn130209961 3.75E-06 ± 1.03E-08 6.70 ± 0.66 5.42 ± 0.30 3.96 ± 0.14 bn130213905 4.97E-07 ± 2.66E-08 0.75 ± 0.41 0.53 ± 0.20 0.48 ± 0.07 bn130214137 8.33E-07 ± 5.13E-08 0.81 ± 0.31 0.47 ± 0.10 0.31 ± 0.05 bn130214800 3.23E-06 ± 4.62E-08 3.57 ± 0.45 3.15 ± 0.22 2.62 ± 0.10 bn130215063 9.95E-06 ± 1.78E-07 2.06 ± 0.48 1.57 ± 0.21 1.22 ± 0.10 bn130215649 1.24E-05 ± 3.01E-08 5.20 ± 1.02 4.00 ± 0.42 3.38 ± 0.19 bn130216790 2.56E-06 ± 1.78E-08 6.36 ± 0.80 4.98 ± 0.32 4.18 ± 0.15 bn130216927 3.79E-06 ± 3.93E-08 7.62 ± 0.64 5.92 ± 0.31 5.23 ± 0.15 bn130217688 6.31E-07 ± 2.99E-08 1.94 ± 0.57 1.48 ± 0.24 1.30 ± 0.12 bn130218261 5.12E-06 ± 4.89E-08 4.17 ± 0.89 3.33 ± 0.43 2.25 ± 0.17 bn130219197 1.66E-05 ± 5.78E-08 2.43 ± 0.43 1.92 ± 0.22 1.40 ± 0.09 bn130219626 1.39E-07 ± 1.21E-08 4.16 ± 0.62 2.22 ± 0.23 0.60 ± 0.09 bn130219775 1.53E-05 ± 3.87E-08 8.85 ± 0.78 7.12 ± 0.35 6.65 ± 0.18 bn130220964 3.99E-06 ± 2.51E-08 11.53 ± 0.65 11.23 ± 0.32 9.61 ± 0.15 bn130224370 2.80E-06 ± 3.12E-08 2.09 ± 0.43 1.63 ± 0.18 1.24 ± 0.08 bn130228111 3.84E-06 ± 2.87E-08 3.58 ± 0.58 2.20 ± 0.26 1.80 ± 0.12 bn130228212 8.81E-06 ± 7.47E-08 14.32 ± 1.97 11.71 ± 0.95 7.96 ± 0.38 bn130304410 1.53E-05 ± 4.76E-08 7.10 ± 1.21 5.98 ± 0.59 3.09 ± 0.21

– 215 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130304658 9.58E-07 ± 2.46E-08 2.52 ± 0.71 1.16 ± 0.22 0.65 ± 0.09 bn130305486 1.85E-05 ± 3.89E-08 14.97 ± 1.02 14.03 ± 0.49 13.24 ± 0.24 bn130305526 8.32E-07 ± 2.46E-08 0.99 ± 0.40 0.66 ± 0.16 0.26 ± 0.06 bn130306991 6.91E-05 ± 3.50E-07 16.05 ± 2.81 11.97 ± 1.26 9.64 ± 0.59 bn130307126 2.52E-07 ± 3.48E-09 4.36 ± 0.60 3.20 ± 0.25 1.42 ± 0.08 bn130307238 2.17E-06 ± 3.23E-08 1.69 ± 0.57 0.84 ± 0.17 0.59 ± 0.08 bn130310840 4.97E-06 ± 3.51E-08 78.95 ± 1.73 42.22 ± 0.77 18.23 ± 0.25 bn130314147 7.89E-06 ± 2.36E-08 2.60 ± 0.48 1.99 ± 0.23 1.51 ± 0.10 bn130318456 1.58E-06 ± 2.38E-08 1.67 ± 0.56 0.95 ± 0.27 0.69 ± 0.12 bn130320560 3.26E-05 ± 3.51E-07 21.25 ± 0.88 20.51 ± 0.44 19.08 ± 0.21 bn130324042 1.27E-06 ± 1.83E-08 1.12 ± 0.33 0.57 ± 0.12 0.42 ± 0.06 bn130325005 4.16E-08 ± 9.29E-09 2.84 ± 0.47 1.06 ± 0.16 0.35 ± 0.07 bn130325203 4.18E-06 ± 1.58E-08 7.77 ± 0.56 7.48 ± 0.29 6.39 ± 0.14 bn130327350 2.75E-05 ± 4.33E-08 9.11 ± 0.82 8.18 ± 0.40 6.87 ± 0.18 bn130331566 5.47E-06 ± 2.71E-08 8.00 ± 1.04 7.61 ± 0.53 6.72 ± 0.25 bn130403866 6.15E-07 ± 3.69E-08 1.65 ± 0.47 0.81 ± 0.21 0.52 ± 0.10 bn130404428 4.90E-07 ± 2.46E-08 3.87 ± 0.56 2.04 ± 0.21 1.42 ± 0.10 bn130404840 3.65E-06 ± 3.45E-08 5.20 ± 0.67 4.81 ± 0.33 4.22 ± 0.16 bn130404877 1.30E-07 ± 3.16E-08 2.48 ± 0.51 1.60 ± 0.23 0.65 ± 0.09 bn130406288 1.73E-06 ± 2.84E-08 7.37 ± 0.61 6.08 ± 0.29 4.58 ± 0.13 bn130406334 1.73E-06 ± 5.92E-08 2.58 ± 0.72 1.54 ± 0.28 1.12 ± 0.12 bn130406354 1.97E-07 ± 1.68E-08 1.24 ± 0.40 1.17 ± 0.20 0.80 ± 0.10 bn130407800 8.88E-07 ± 2.70E-08 1.07 ± 0.34 0.63 ± 0.14 0.33 ± 0.06 bn130408653 1.16E-06 ± 2.62E-08 3.74 ± 0.68 3.34 ± 0.34 1.98 ± 0.14 bn130409960 4.41E-06 ± 2.61E-08 4.18 ± 0.60 3.96 ± 0.29 3.63 ± 0.14 bn130416690 1.73E-07 ± 1.03E-08 1.45 ± 0.40 0.91 ± 0.19 0.68 ± 0.09 bn130416770 2.79E-07 ± 1.03E-08 10.67 ± 0.99 4.52 ± 0.32 1.27 ± 0.10 bn130418844 2.87E-06 ± 1.80E-08 1.73 ± 0.50 1.13 ± 0.18 0.86 ± 0.07 bn130420313 5.79E-06 ± 1.30E-07 2.47 ± 0.76 1.76 ± 0.35 1.38 ± 0.17 bn130420343 3.90E-06 ± 3.35E-08 1.90 ± 0.39 1.48 ± 0.17 1.15 ± 0.09 bn130420422 2.02E-06 ± 2.35E-08 3.73 ± 0.85 2.83 ± 0.34 2.23 ± 0.15 bn130420539 8.76E-07 ± 3.46E-08 1.37 ± 0.43 0.86 ± 0.19 0.71 ± 0.09

– 216 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130425327 2.22E-05 ± 7.08E-08 15.05 ± 2.18 11.76 ± 0.94 9.36 ± 0.43 bn130427324 8.17E-04 ± 6.59E-07 576.56 ± 7.07 556.91 ± 3.58 496.29 ± 1.62 bn130502327 5.70E-05 ± 3.84E-08 47.10 ± 1.62 40.08 ± 0.76 26.14 ± 0.32 bn130502743 3.64E-07 ± 2.09E-08 2.97 ± 0.66 2.23 ± 0.30 1.11 ± 0.11 bn130503214 2.67E-08 ± 5.16E-09 3.28 ± 0.54 1.10 ± 0.20 0.24 ± 0.09 bn130504314 1.46E-06 ± 1.77E-08 24.19 ± 1.21 15.90 ± 0.65 6.22 ± 0.22 bn130504978 5.60E-05 ± 1.18E-07 24.79 ± 1.45 23.91 ± 0.71 19.52 ± 0.31 bn130505955 4.25E-06 ± 1.09E-07 3.68 ± 0.72 2.81 ± 0.29 2.04 ± 0.13 bn130507545 2.42E-06 ± 2.48E-08 1.62 ± 0.41 1.52 ± 0.20 1.02 ± 0.08 bn130509078 4.65E-06 ± 3.12E-08 5.70 ± 0.65 4.40 ± 0.29 4.04 ± 0.14 bn130509839 8.96E-07 ± 1.26E-08 0.82 ± 0.28 0.49 ± 0.11 0.32 ± 0.06 bn130510877 1.68E-06 ± 4.16E-08 2.00 ± 0.47 1.18 ± 0.20 0.95 ± 0.09 bn130514560 1.27E-06 ± 2.53E-08 3.99 ± 0.86 3.57 ± 0.40 2.66 ± 0.19 bn130515056 2.92E-07 ± 4.81E-09 8.13 ± 0.86 4.79 ± 0.35 1.36 ± 0.12 bn130515430 5.20E-07 ± 2.28E-08 0.92 ± 0.32 0.67 ± 0.15 0.45 ± 0.07 bn130515755 4.06E-07 ± 1.09E-08 2.25 ± 0.55 2.03 ± 0.28 1.39 ± 0.13 bn130517781 1.09E-05 ± 4.22E-08 4.18 ± 0.56 3.58 ± 0.27 3.13 ± 0.13 bn130518551 1.42E-06 ± 2.57E-08 8.63 ± 0.80 6.57 ± 0.29 3.47 ± 0.11 bn130518580 4.46E-05 ± 8.03E-08 23.01 ± 1.04 22.44 ± 0.52 21.33 ± 0.26 bn130522510 1.88E-06 ± 1.93E-08 2.90 ± 0.48 2.04 ± 0.22 1.61 ± 0.11 bn130523095 3.39E-06 ± 2.85E-08 5.43 ± 0.82 4.80 ± 0.40 3.61 ± 0.18 bn130523198 1.29E-06 ± 1.73E-08 3.17 ± 0.44 2.60 ± 0.21 2.29 ± 0.10 bn130527627 6.14E-06 ± 3.62E-08 3.56 ± 0.64 2.56 ± 0.27 2.30 ± 0.13 bn130528503 1.88E-06 ± 1.46E-08 1.57 ± 0.41 1.34 ± 0.20 1.01 ± 0.08 bn130528695 6.61E-06 ± 6.89E-08 4.72 ± 0.68 3.73 ± 0.31 3.10 ± 0.14 bn130530719 3.49E-06 ± 2.14E-08 2.51 ± 0.48 1.67 ± 0.20 1.32 ± 0.10 bn130604033 9.44E-06 ± 6.71E-08 9.33 ± 0.85 7.49 ± 0.38 5.34 ± 0.17 bn130606316 4.66E-06 ± 2.25E-08 4.82 ± 0.48 3.81 ± 0.21 3.18 ± 0.10 bn130606497 8.86E-05 ± 1.05E-07 32.55 ± 1.64 29.88 ± 0.75 26.48 ± 0.34 bn130609129 4.56E-07 ± 3.45E-08 1.04 ± 0.38 0.76 ± 0.14 0.65 ± 0.06 bn130609902 2.45E-05 ± 1.68E-07 9.08 ± 1.12 8.32 ± 0.56 7.40 ± 0.25 bn130610133 2.10E-06 ± 2.45E-08 2.27 ± 0.55 1.61 ± 0.25 1.27 ± 0.12

– 217 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130611538 4.02E-06 ± 5.08E-08 2.06 ± 0.49 1.30 ± 0.23 0.98 ± 0.10 bn130612141 3.24E-07 ± 4.24E-08 0.31 ± 0.08 0.28 ± 0.04 0.24 ± 0.04 bn130612456 5.10E-06 ± 2.15E-08 13.58 ± 0.88 12.84 ± 0.43 11.48 ± 0.20 bn130614997 3.51E-06 ± 4.84E-08 7.63 ± 0.67 6.27 ± 0.44 4.86 ± 0.14 bn130615398 1.51E-06 ± 8.16E-08 2.21 ± 0.69 1.58 ± 0.30 0.92 ± 0.13 bn130617564 1.35E-07 ± 8.74E-09 1.85 ± 0.54 1.53 ± 0.26 1.02 ± 0.12 bn130620498 7.48E-07 ± 3.42E-08 1.66 ± 0.40 1.40 ± 0.19 1.19 ± 0.09 bn130622615 2.52E-07 ± 1.20E-08 3.39 ± 0.57 2.43 ± 0.23 1.28 ± 0.09 bn130623130 5.48E-07 ± 9.98E-09 1.53 ± 0.36 1.17 ± 0.16 0.69 ± 0.07 bn130623396 5.95E-07 ± 2.70E-08 1.22 ± 0.35 0.75 ± 0.18 0.49 ± 0.08 bn130623488 1.10E-06 ± 1.64E-08 1.60 ± 0.50 1.13 ± 0.22 0.82 ± 0.09 bn130623699 4.40E-07 ± 2.16E-08 1.33 ± 0.54 0.76 ± 0.22 0.49 ± 0.09 bn130623790 4.37E-06 ± 2.96E-08 5.66 ± 0.78 4.09 ± 0.30 3.37 ± 0.14 bn130624093 2.93E-07 ± 1.20E-08 1.45 ± 0.38 0.84 ± 0.17 0.53 ± 0.09 bn130626452 1.17E-07 ± 4.46E-09 3.28 ± 0.65 1.81 ± 0.23 0.55 ± 0.08 bn130626596 2.71E-06 ± 1.45E-08 3.75 ± 0.68 2.51 ± 0.29 1.69 ± 0.12 bn130627372 8.93E-07 ± 1.31E-08 2.15 ± 0.49 1.84 ± 0.24 0.97 ± 0.09 bn130628531 4.81E-06 ± 2.95E-08 7.92 ± 0.60 7.72 ± 0.32 5.66 ± 0.14 bn130628860 2.99E-07 ± 5.51E-09 8.64 ± 0.97 3.45 ± 0.29 1.38 ± 0.09 bn130630272 9.86E-06 ± 3.85E-08 7.50 ± 1.02 6.38 ± 0.49 5.71 ± 0.24 bn130701060 3.77E-06 ± 4.96E-08 6.34 ± 1.02 5.43 ± 0.49 4.56 ± 0.23 bn130701761 1.88E-06 ± 1.40E-08 8.52 ± 0.89 6.51 ± 0.38 5.22 ± 0.17 bn130702004 2.85E-06 ± 6.37E-08 2.69 ± 0.73 1.69 ± 0.34 1.24 ± 0.18 bn130702951 4.34E-07 ± 2.09E-08 0.87 ± 0.32 0.71 ± 0.12 0.46 ± 0.06 bn130704560 1.38E-05 ± 2.92E-08 31.54 ± 1.27 26.75 ± 0.59 23.03 ± 0.28 bn130705398 7.78E-08 ± 1.34E-08 3.32 ± 0.68 1.76 ± 0.24 0.52 ± 0.09 bn130706900 9.65E-08 ± 1.32E-08 4.20 ± 0.58 1.93 ± 0.25 0.44 ± 0.08 bn130707505 5.43E-06 ± 5.90E-08 3.75 ± 0.98 2.30 ± 0.41 1.66 ± 0.19 bn130708488 1.45E-06 ± 1.44E-08 2.29 ± 0.46 1.53 ± 0.18 1.03 ± 0.07 bn130715906 2.09E-05 ± 8.90E-08 4.87 ± 0.72 4.34 ± 0.36 3.73 ± 0.17 bn130716352 1.63E-06 ± 3.14E-08 1.40 ± 0.41 0.88 ± 0.18 0.54 ± 0.08 bn130716442 2.13E-07 ± 4.02E-09 2.74 ± 0.59 2.12 ± 0.26 0.93 ± 0.09

– 218 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130717734 9.53E-07 ± 2.32E-08 1.56 ± 0.41 1.27 ± 0.20 0.64 ± 0.09 bn130720116 2.22E-06 ± 3.32E-08 2.45 ± 0.56 1.82 ± 0.22 1.35 ± 0.10 bn130720582 5.11E-05 ± 8.38E-08 9.63 ± 0.79 8.33 ± 0.38 7.39 ± 0.18 bn130722021 6.78E-07 ± 2.16E-08 1.39 ± 0.43 0.55 ± 0.13 0.28 ± 0.05 bn130722990 3.39E-07 ± 9.47E-09 2.66 ± 0.52 2.15 ± 0.22 1.37 ± 0.09 bn130723092 4.24E-07 ± 1.57E-08 1.95 ± 0.37 1.66 ± 0.19 1.35 ± 0.09 bn130725527 2.77E-06 ± 3.28E-08 8.51 ± 0.73 7.53 ± 0.36 5.59 ± 0.15 bn130727698 4.58E-06 ± 3.40E-08 6.05 ± 0.95 5.09 ± 0.44 4.04 ± 0.21 bn130730243 1.04E-06 ± 2.29E-08 1.48 ± 0.49 1.06 ± 0.20 0.69 ± 0.10 bn130802730 1.20E-07 ± 7.08E-09 5.11 ± 0.73 1.56 ± 0.25 0.39 ± 0.11 bn130803419 1.79E-06 ± 2.25E-08 5.02 ± 0.69 3.96 ± 0.32 3.37 ± 0.15 bn130804023 8.10E-07 ± 8.61E-09 22.88 ± 1.21 9.24 ± 0.40 3.67 ± 0.13 bn130808253 1.22E-07 ± 9.39E-09 6.77 ± 0.86 3.48 ± 0.36 0.95 ± 0.11 bn130811186 3.23E-06 ± 4.37E-08 1.68 ± 0.37 1.50 ± 0.20 1.19 ± 0.09 bn130813791 6.68E-07 ± 1.18E-08 2.30 ± 0.41 1.67 ± 0.19 1.01 ± 0.08 bn130815420 2.71E-05 ± 5.68E-08 5.01 ± 0.64 3.78 ± 0.31 2.94 ± 0.13 bn130815660 6.91E-06 ± 2.63E-08 13.91 ± 0.89 12.77 ± 0.43 11.38 ± 0.20 bn130816074 3.75E-07 ± 1.40E-08 1.16 ± 0.38 0.77 ± 0.16 0.41 ± 0.06 bn130818941 2.06E-06 ± 3.47E-08 5.27 ± 0.64 4.36 ± 0.31 2.70 ± 0.13 bn130819394 4.84E-06 ± 3.66E-08 1.71 ± 0.48 1.14 ± 0.21 0.90 ± 0.09 bn130821674 2.92E-05 ± 4.32E-08 18.92 ± 0.94 17.10 ± 0.44 11.84 ± 0.18 bn130828306 2.13E-05 ± 3.13E-08 4.26 ± 0.64 3.27 ± 0.28 3.11 ± 0.13 bn130828808 1.42E-06 ± 1.65E-08 5.27 ± 0.59 4.42 ± 0.27 3.45 ± 0.13 bn130829672 2.14E-06 ± 2.60E-08 5.01 ± 0.82 4.36 ± 0.39 3.78 ± 0.19 bn130830864 1.06E-06 ± 2.71E-08 1.24 ± 0.40 0.64 ± 0.16 0.39 ± 0.06 bn130830921 8.01E-07 ± 1.73E-08 1.86 ± 0.58 0.97 ± 0.22 0.63 ± 0.10 bn130831058 1.14E-06 ± 1.30E-08 1.23 ± 0.42 0.78 ± 0.19 0.60 ± 0.08 bn130903033 1.17E-06 ± 2.90E-08 0.90 ± 0.42 0.63 ± 0.18 0.29 ± 0.06 bn130905377 2.46E-06 ± 4.38E-08 2.54 ± 0.50 1.96 ± 0.24 1.61 ± 0.11 bn130906222 3.48E-07 ± 1.58E-08 1.28 ± 0.44 0.83 ± 0.18 0.57 ± 0.08 bn130906435 4.60E-07 ± 1.83E-08 1.86 ± 0.40 1.58 ± 0.21 1.03 ± 0.09 bn130907760 1.43E-07 ± 1.53E-08 1.77 ± 0.37 1.07 ± 0.14 0.58 ± 0.06

– 219 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn130908677 1.85E-06 ± 9.29E-08 1.38 ± 0.47 0.95 ± 0.23 0.53 ± 0.11 bn130909817 1.05E-06 ± 3.25E-08 0.92 ± 0.33 0.66 ± 0.16 0.40 ± 0.06 bn130912358 4.07E-07 ± 1.09E-08 8.53 ± 0.80 5.76 ± 0.36 2.14 ± 0.13 bn130919173 2.29E-07 ± 4.64E-09 7.46 ± 0.65 4.36 ± 0.27 1.44 ± 0.09 bn130919352 2.55E-06 ± 1.87E-08 1.54 ± 0.34 1.11 ± 0.15 0.67 ± 0.07 bn130919985 1.50E-06 ± 3.93E-08 1.98 ± 0.53 1.35 ± 0.26 0.95 ± 0.13 bn130924255 2.00E-06 ± 2.90E-08 2.99 ± 0.69 2.41 ± 0.32 1.45 ± 0.13 bn130924910 2.08E-07 ± 1.57E-08 2.34 ± 0.43 1.61 ± 0.18 0.97 ± 0.08 bn130925164 2.83E-07 ± 1.30E-08 0.85 ± 0.37 0.50 ± 0.15 0.41 ± 0.07 bn130925173 4.08E-05 ± 1.40E-07 3.51 ± 0.49 3.06 ± 0.23 2.66 ± 0.11 bn130925546 7.49E-06 ± 1.20E-07 3.25 ± 0.96 1.97 ± 0.44 1.52 ± 0.17 bn130928537 7.32E-06 ± 3.59E-08 2.68 ± 0.81 1.98 ± 0.33 1.20 ± 0.13 bn130929375 1.32E-07 ± 5.82E-09 0.82 ± 0.23 0.46 ± 0.11 0.35 ± 0.05 bn131002288 6.71E-07 ± 2.72E-08 1.73 ± 0.55 1.22 ± 0.32 0.68 ± 0.12 bn131004904 2.98E-07 ± 1.02E-08 3.67 ± 0.68 2.75 ± 0.31 1.83 ± 0.12 bn131006367 4.94E-08 ± 7.64E-09 2.10 ± 0.52 1.07 ± 0.23 0.28 ± 0.10 bn131006840 9.40E-07 ± 2.81E-08 2.71 ± 0.61 1.30 ± 0.24 0.86 ± 0.11 bn131008858 4.43E-06 ± 3.42E-08 4.29 ± 1.03 2.61 ± 0.38 2.15 ± 0.18 bn131011741 5.06E-06 ± 3.78E-08 2.67 ± 0.39 2.22 ± 0.24 1.95 ± 0.11 bn131014215 9.55E-05 ± 7.52E-08 253.48 ± 3.99 230.39 ± 1.91 174.06 ± 0.82 bn131014513 1.13E-06 ± 2.55E-08 2.27 ± 0.60 1.28 ± 0.22 0.87 ± 0.09 bn131018673 1.60E-06 ± 6.16E-08 1.46 ± 0.44 0.97 ± 0.19 0.58 ± 0.09 bn131020113 1.80E-07 ± 1.66E-08 1.29 ± 0.40 0.84 ± 0.19 0.67 ± 0.09 bn131021352 6.97E-07 ± 2.61E-08 4.84 ± 0.73 3.68 ± 0.33 1.46 ± 0.13 bn131024900 7.50E-07 ± 2.33E-08 1.88 ± 0.40 1.27 ± 0.19 0.74 ± 0.09 bn131028076 5.12E-05 ± 7.34E-08 31.52 ± 1.88 29.19 ± 0.93 27.54 ± 0.46 bn131028096 7.93E-07 ± 2.93E-08 0.73 ± 0.46 0.67 ± 0.11 0.48 ± 0.05 bn131029973 1.54E-05 ± 6.83E-08 3.10 ± 0.51 2.42 ± 0.23 2.23 ± 0.11 bn131029990 2.44E-06 ± 5.13E-08 1.41 ± 0.38 0.82 ± 0.16 0.66 ± 0.07 bn131030653 9.33E-07 ± 1.74E-08 1.67 ± 0.42 1.09 ± 0.17 0.60 ± 0.07 bn131030791 2.09E-06 ± 1.64E-08 2.49 ± 0.42 1.94 ± 0.20 1.61 ± 0.09 bn131031482 2.41E-06 ± 3.16E-08 8.35 ± 0.70 6.33 ± 0.30 4.57 ± 0.13

– 220 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn131102622 7.67E-07 ± 2.49E-08 1.07 ± 0.38 0.61 ± 0.17 0.34 ± 0.07 bn131105087 1.32E-05 ± 5.70E-08 4.93 ± 0.58 4.59 ± 0.30 3.57 ± 0.13 bn131108024 1.56E-06 ± 2.61E-08 4.33 ± 0.61 3.62 ± 0.31 2.73 ± 0.14 bn131108862 1.71E-05 ± 6.69E-08 16.82 ± 1.02 12.95 ± 0.44 9.64 ± 0.19 bn131110373 2.10E-06 ± 2.25E-08 1.71 ± 0.47 1.24 ± 0.21 0.84 ± 0.09 bn131113483 1.32E-05 ± 5.22E-08 5.25 ± 0.66 3.92 ± 0.31 3.53 ± 0.15 bn131117766 8.93E-06 ± 3.93E-08 1.80 ± 0.38 1.43 ± 0.17 1.21 ± 0.08 bn131118958 3.61E-05 ± 1.94E-07 9.94 ± 1.54 8.10 ± 0.65 6.03 ± 0.30 bn131119781 1.11E-06 ± 1.45E-08 1.83 ± 0.40 1.39 ± 0.19 0.98 ± 0.09 bn131122490 1.49E-05 ± 3.95E-08 9.48 ± 0.84 8.67 ± 0.46 7.30 ± 0.22 bn131123543 2.43E-07 ± 1.47E-08 3.18 ± 0.55 1.88 ± 0.20 0.96 ± 0.08 bn131125689 1.75E-07 ± 1.51E-08 3.75 ± 1.07 1.77 ± 0.31 0.84 ± 0.10 bn131126163 5.47E-07 ± 1.47E-08 18.42 ± 1.56 9.57 ± 0.60 2.43 ± 0.17 bn131127480 2.25E-06 ± 2.97E-08 0.84 ± 0.30 0.54 ± 0.10 0.44 ± 0.05 bn131127592 2.07E-05 ± 7.63E-08 23.05 ± 1.13 21.27 ± 0.56 16.44 ± 0.24 bn131127696 6.70E-07 ± 3.30E-08 1.25 ± 0.35 1.08 ± 0.17 0.68 ± 0.07 bn131128629 2.91E-07 ± 2.22E-08 1.92 ± 0.57 1.55 ± 0.27 1.09 ± 0.13 bn131202633 4.47E-07 ± 2.72E-08 0.87 ± 0.31 0.66 ± 0.14 0.43 ± 0.06 bn131202906 6.58E-06 ± 2.37E-08 2.53 ± 0.58 1.69 ± 0.27 1.32 ± 0.12 bn131204937 9.47E-07 ± 1.22E-08 1.66 ± 0.47 1.03 ± 0.19 0.69 ± 0.09 bn131209547 7.42E-06 ± 4.69E-08 5.96 ± 0.68 5.61 ± 0.33 4.84 ± 0.16 bn131209963 4.48E-07 ± 4.81E-08 2.25 ± 0.50 1.82 ± 0.25 1.26 ± 0.12 bn131211510 2.24E-06 ± 2.63E-08 1.94 ± 0.50 1.22 ± 0.23 0.78 ± 0.06 bn131212814 2.45E-07 ± 2.60E-08 0.72 ± 0.36 0.43 ± 0.13 0.36 ± 0.06 bn131214705 3.57E-05 ± 1.10E-07 9.77 ± 0.76 9.25 ± 0.38 8.97 ± 0.18 bn131215298 3.83E-06 ± 4.24E-08 4.65 ± 0.76 3.29 ± 0.31 2.78 ± 0.15 bn131216081 3.28E-06 ± 2.17E-08 5.62 ± 0.59 5.10 ± 0.29 4.50 ± 0.14 bn131217108 3.53E-07 ± 2.77E-08 3.82 ± 0.76 3.00 ± 0.35 1.64 ± 0.13 bn131217183 2.89E-06 ± 4.07E-08 3.96 ± 0.56 3.31 ± 0.28 2.34 ± 0.12 bn131217506 2.89E-06 ± 4.07E-08 3.96 ± 0.56 3.31 ± 0.28 2.34 ± 0.12 bn131229277 1.29E-05 ± 3.11E-08 19.49 ± 1.21 16.63 ± 0.56 13.86 ± 0.26 bn131230529 3.24E-07 ± 1.91E-08 2.11 ± 0.72 1.46 ± 0.35 0.97 ± 0.16

– 221 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn131230808 2.21E-06 ± 2.03E-08 1.55 ± 0.40 1.01 ± 0.16 0.75 ± 0.08 bn131231198 7.96E-05 ± 6.76E-08 39.73 ± 1.51 38.05 ± 0.75 36.31 ± 0.37 bn140102887 1.08E-05 ± 1.19E-08 30.97 ± 1.10 28.98 ± 0.54 25.03 ± 0.25 bn140104731 1.59E-05 ± 3.22E-08 2.92 ± 0.47 2.63 ± 0.22 2.32 ± 0.11 bn140105065 3.49E-07 ± 9.26E-09 4.47 ± 0.64 3.28 ± 0.30 1.64 ± 0.11 bn140105748 7.15E-08 ± 1.15E-08 1.18 ± 0.26 0.80 ± 0.12 0.57 ± 0.06 bn140106345 1.34E-06 ± 4.60E-08 1.84 ± 0.55 1.09 ± 0.20 0.86 ± 0.10 bn140108721 9.95E-06 ± 1.23E-07 5.42 ± 0.53 4.68 ± 0.27 4.42 ± 0.14 bn140109771 6.51E-08 ± 1.65E-08 3.04 ± 0.97 1.22 ± 0.29 0.54 ± 0.10 bn140109877 7.93E-08 ± 1.34E-08 0.26 ± 0.35 0.14 ± 0.11 0.06 ± 0.04 bn140110263 2.44E-06 ± 2.52E-08 2.76 ± 0.57 2.09 ± 0.18 1.81 ± 0.10 bn140110411 2.16E-08 ± 2.89E-09 0.74 ± 0.26 0.35 ± 0.11 0.16 ± 0.05 bn140110814 4.74E-06 ± 8.01E-08 4.15 ± 1.09 2.11 ± 0.40 1.94 ± 0.18 bn140112060 9.08E-07 ± 2.22E-08 1.37 ± 0.37 1.06 ± 0.17 0.80 ± 0.08 bn140113183 1.36E-06 ± 2.55E-08 0.79 ± 0.23 0.70 ± 0.10 0.46 ± 0.05 bn140113624 2.80E-07 ± 1.99E-08 1.41 ± 0.44 0.87 ± 0.17 0.63 ± 0.07 bn140115863 2.31E-06 ± 2.04E-08 3.54 ± 0.62 3.31 ± 0.27 2.07 ± 0.11 bn140115899 1.42E-06 ± 2.91E-08 3.12 ± 0.67 2.42 ± 0.30 2.16 ± 0.15 bn140118064 1.81E-06 ± 2.46E-08 1.14 ± 0.45 0.56 ± 0.19 0.41 ± 0.08 bn140122597 5.94E-07 ± 3.63E-08 3.02 ± 0.69 2.00 ± 0.29 1.41 ± 0.13 bn140124527 1.05E-05 ± 7.55E-08 2.93 ± 0.56 2.30 ± 0.23 1.88 ± 0.10 bn140126815 3.11E-06 ± 2.07E-08 2.15 ± 0.48 1.41 ± 0.20 1.24 ± 0.10 bn140129499 1.19E-07 ± 8.63E-09 3.96 ± 0.71 2.41 ± 0.29 0.64 ± 0.09 bn140204547 1.30E-06 ± 2.21E-08 1.23 ± 0.40 0.70 ± 0.16 0.55 ± 0.08 bn140206275 5.82E-05 ± 1.46E-07 22.04 ± 0.91 21.49 ± 0.46 21.00 ± 0.23 bn140206304 9.99E-06 ± 5.05E-08 14.07 ± 1.21 12.70 ± 0.58 9.00 ± 0.25 bn140209313 5.73E-06 ± 2.81E-08 66.72 ± 2.18 58.87 ± 1.03 27.09 ± 0.36 bn140211091 4.18E-07 ± 1.65E-08 1.63 ± 0.45 1.20 ± 0.18 0.97 ± 0.09 bn140213807 1.11E-05 ± 3.58E-08 12.03 ± 0.78 11.35 ± 0.38 10.10 ± 0.18 bn140216331 2.84E-07 ± 3.31E-08 1.32 ± 0.33 1.05 ± 0.17 0.89 ± 0.08 bn140217043 1.25E-06 ± 2.03E-08 2.29 ± 0.55 1.62 ± 0.25 1.14 ± 0.10 bn140218427 3.18E-06 ± 4.14E-08 1.44 ± 0.37 0.74 ± 0.17 0.55 ± 0.06

– 222 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn140219319 1.61E-06 ± 1.47E-08 2.61 ± 0.52 2.13 ± 0.22 1.76 ± 0.10 bn140219824 1.48E-06 ± 2.20E-08 1.37 ± 0.46 1.02 ± 0.21 0.70 ± 0.09 bn140223495 1.17E-06 ± 1.92E-08 1.41 ± 0.39 1.09 ± 0.18 0.83 ± 0.08 bn140224382 3.81E-07 ± 2.15E-08 4.05 ± 0.57 2.68 ± 0.26 1.66 ± 0.12 bn140224788 1.47E-06 ± 2.98E-08 1.76 ± 0.40 1.51 ± 0.20 1.25 ± 0.09 bn140227738 4.29E-07 ± 4.95E-08 1.22 ± 0.55 0.88 ± 0.25 0.67 ± 0.11 bn140302342 3.81E-06 ± 2.57E-08 2.75 ± 0.58 2.35 ± 0.27 1.64 ± 0.11 bn140304557 1.45E-06 ± 1.74E-08 1.63 ± 0.43 1.20 ± 0.18 0.99 ± 0.09 bn140304849 4.77E-06 ± 3.40E-08 2.65 ± 0.59 2.12 ± 0.25 1.48 ± 0.12 bn140306146 2.09E-05 ± 4.86E-08 7.99 ± 0.69 6.38 ± 0.31 5.62 ± 0.13 bn140308710 3.55E-06 ± 2.27E-08 12.32 ± 0.99 11.66 ± 0.46 7.82 ± 0.19 bn140311453 1.34E-06 ± 2.02E-08 1.71 ± 0.35 1.31 ± 0.17 1.12 ± 0.09 bn140311618 2.07E-06 ± 6.44E-08 4.02 ± 0.66 3.39 ± 0.29 2.84 ± 0.14 bn140311885 4.00E-06 ± 3.42E-08 2.39 ± 0.62 1.34 ± 0.26 0.94 ± 0.11 bn140319964 4.12E-06 ± 1.81E-08 4.62 ± 0.57 4.15 ± 0.28 2.52 ± 0.12 bn140320092 4.85E-08 ± 4.26E-09 0.62 ± 0.18 0.39 ± 0.09 0.22 ± 0.04 bn140322424 8.43E-07 ± 1.50E-08 1.59 ± 0.44 1.38 ± 0.21 1.03 ± 0.10 bn140323433 1.81E-05 ± 1.08E-07 5.79 ± 0.55 5.25 ± 0.27 4.89 ± 0.14 bn140327065 4.97E-07 ± 2.17E-08 1.63 ± 0.40 1.15 ± 0.18 0.95 ± 0.10 bn140328560 4.05E-07 ± 6.57E-09 1.63 ± 0.39 1.10 ± 0.18 0.82 ± 0.09 bn140329272 1.07E-07 ± 4.99E-09 4.44 ± 0.53 2.30 ± 0.21 0.57 ± 0.07 bn140329295 3.62E-05 ± 1.93E-08 62.55 ± 2.30 54.10 ± 1.06 47.16 ± 0.50 bn140330180 3.08E-06 ± 4.92E-08 3.51 ± 0.62 2.63 ± 0.25 2.33 ± 0.12 bn140402007 1.53E-07 ± 1.54E-08 3.27 ± 0.49 2.26 ± 0.23 0.74 ± 0.09 bn140404030 1.15E-06 ± 3.91E-08 1.07 ± 0.44 0.86 ± 0.20 0.63 ± 0.08 bn140404171 4.53E-06 ± 1.21E-08 2.26 ± 0.39 1.71 ± 0.18 1.46 ± 0.09 bn140404900 2.71E-06 ± 2.04E-08 2.02 ± 0.40 1.66 ± 0.20 1.33 ± 0.09 bn140405033 1.46E-06 ± 1.87E-08 1.87 ± 0.45 1.16 ± 0.19 0.89 ± 0.09 bn140406120 5.84E-06 ± 5.77E-08 4.12 ± 0.71 3.16 ± 0.30 1.82 ± 0.12 bn140406144 1.51E-06 ± 5.23E-08 1.26 ± 0.41 0.69 ± 0.16 0.50 ± 0.08 bn140408553 4.06E-07 ± 2.74E-08 1.39 ± 0.46 0.87 ± 0.17 0.73 ± 0.09 bn140414693 3.61E-06 ± 2.12E-08 3.34 ± 0.44 2.66 ± 0.20 2.17 ± 0.09

– 223 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn140416060 4.20E-05 ± 1.95E-07 53.74 ± 3.26 49.06 ± 1.56 34.80 ± 0.65 bn140422194 2.21E-06 ± 5.48E-08 1.71 ± 0.45 0.86 ± 0.21 0.63 ± 0.10 bn140423356 1.14E-05 ± 6.80E-08 2.23 ± 0.44 1.72 ± 0.21 1.38 ± 0.10 bn140426515 1.20E-06 ± 1.72E-08 1.44 ± 0.38 0.75 ± 0.18 0.60 ± 0.08 bn140427702 2.74E-07 ± 3.44E-08 1.90 ± 0.74 1.02 ± 0.33 0.61 ± 0.12 bn140428906 3.60E-07 ± 1.09E-08 10.71 ± 1.35 5.43 ± 0.50 1.70 ± 0.14 bn140429975 3.20E-07 ± 1.13E-08 1.24 ± 0.40 0.72 ± 0.20 0.56 ± 0.09 bn140430716 5.50E-06 ± 8.72E-08 7.35 ± 0.97 6.30 ± 0.48 5.43 ± 0.22 bn140501139 9.64E-08 ± 1.07E-08 2.84 ± 0.72 1.76 ± 0.26 0.46 ± 0.10 bn140501497 3.97E-06 ± 2.44E-08 4.91 ± 0.78 4.26 ± 0.38 3.52 ± 0.17 bn140502354 1.14E-06 ± 1.91E-08 1.54 ± 0.36 1.08 ± 0.17 0.74 ± 0.08 bn140506880 3.22E-06 ± 4.86E-08 13.62 ± 1.49 10.31 ± 0.66 6.39 ± 0.28 bn140508128 3.09E-05 ± 6.22E-08 41.40 ± 2.53 39.49 ± 1.24 31.45 ± 0.55 bn140508179 2.02E-06 ± 4.46E-08 2.72 ± 0.98 1.58 ± 0.42 1.23 ± 0.20 bn140508629 1.38E-06 ± 2.49E-08 1.63 ± 0.34 1.17 ± 0.16 0.88 ± 0.07 bn140511095 2.31E-07 ± 1.88E-08 5.32 ± 0.55 3.21 ± 0.22 1.10 ± 0.08 bn140511995 3.72E-06 ± 2.09E-08 3.07 ± 0.62 1.87 ± 0.26 1.43 ± 0.11 bn140512814 1.50E-05 ± 4.45E-08 6.77 ± 0.65 6.24 ± 0.29 4.84 ± 0.12 bn140513724 2.26E-06 ± 3.13E-08 2.85 ± 0.46 2.32 ± 0.22 1.83 ± 0.10 bn140516700 1.61E-06 ± 1.80E-08 1.46 ± 0.40 1.27 ± 0.19 0.70 ± 0.08 bn140516765 3.58E-06 ± 6.58E-08 3.92 ± 0.55 3.20 ± 0.28 2.46 ± 0.13 bn140517813 2.72E-06 ± 2.27E-08 2.58 ± 0.57 1.88 ± 0.21 1.54 ± 0.10 bn140518709 1.86E-07 ± 2.33E-08 2.56 ± 0.90 1.68 ± 0.37 1.02 ± 0.16 bn140519043 2.14E-06 ± 1.96E-08 1.56 ± 0.42 1.09 ± 0.20 0.84 ± 0.09 bn140521184 1.41E-06 ± 2.12E-08 1.22 ± 0.38 0.63 ± 0.14 0.46 ± 0.06 bn140521732 1.50E-06 ± 2.53E-08 3.06 ± 0.58 2.46 ± 0.25 1.91 ± 0.11 bn140523129 2.71E-05 ± 2.47E-08 28.24 ± 1.37 25.31 ± 0.68 20.50 ± 0.28 bn140526449 3.81E-06 ± 1.89E-08 3.93 ± 0.54 1.13 ± 0.20 0.77 ± 0.07 bn140526571 8.00E-08 ± 6.38E-09 2.75 ± 0.61 1.49 ± 0.23 0.36 ± 0.07 bn140528837 1.24E-05 ± 2.62E-08 10.80 ± 0.85 9.34 ± 0.44 7.89 ± 0.20 bn140603476 1.21E-05 ± 1.60E-07 2.15 ± 0.42 1.68 ± 0.22 1.37 ± 0.10 bn140605377 2.57E-07 ± 4.62E-09 5.08 ± 0.66 3.62 ± 0.27 1.11 ± 0.09

– 224 –

Table 8—Continued

Trigger Fluence PF64 PF256 PF1024 ID (erg cm^{−2}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1}) (ph cm^{−2} s^{−1})

bn140606133 3.75E-06 ± 2.42E-08 6.06 ± 0.66 5.72 ± 0.29 5.24 ± 0.13 bn140608153 6.76E-06 ± 1.19E-07 3.23 ± 0.92 2.09 ± 0.44 1.64 ± 0.20 bn140608713 1.15E-06 ± 3.40E-08 5.75 ± 1.03 5.16 ± 0.49 3.09 ± 0.18 bn140610487 1.49E-07 ± 1.96E-08 2.33 ± 0.66 1.82 ± 0.24 0.73 ± 0.10 bn140610548 1.05E-05 ± 2.82E-08 5.38 ± 0.64 4.79 ± 0.30 4.34 ± 0.15 bn140610689 6.26E-06 ± 6.04E-08 1.70 ± 0.47 0.87 ± 0.18 0.51 ± 0.07 bn140612294 2.40E-06 ± 4.78E-08 1.69 ± 0.41 1.37 ± 0.20 1.00 ± 0.08 bn140616165 1.85E-07 ± 2.24E-08 6.29 ± 1.01 4.05 ± 0.35 1.31 ± 0.11 bn140619475 4.87E-07 ± 3.41E-08 3.35 ± 0.48 2.64 ± 0.23 1.67 ± 0.14 bn140619490 1.28E-07 ± 2.67E-08 5.95 ± 0.97 2.18 ± 0.38 0.74 ± 0.16 bn140620219 3.43E-06 ± 3.32E-08 2.97 ± 0.63 2.27 ± 0.30 1.88 ± 0.14 bn140621827 2.73E-06 ± 2.86E-08 19.10 ± 1.21 9.36 ± 0.45 4.53 ± 0.17 bn140623224 1.69E-06 ± 2.55E-08 1.35 ± 0.39 0.87 ± 0.16 0.56 ± 0.07 bn140624423 1.53E-07 ± 5.13E-09 9.12 ± 0.62 2.83 ± 0.21 0.71 ± 0.07 bn140626843 6.33E-07 ± 2.08E-08 4.73 ± 0.81 3.10 ± 0.31 2.28 ± 0.15 bn140627401 3.79E-07 ± 2.91E-08 1.36 ± 0.40 0.87 ± 0.17 0.57 ± 0.08 bn140628626 8.26E-07 ± 3.44E-08 1.67 ± 0.53 0.83 ± 0.22 0.47 ± 0.07 bn140628704 9.98E-07 ± 5.34E-08 1.61 ± 0.63 0.90 ± 0.22 0.62 ± 0.10 bn140630505 4.42E-06 ± 4.18E-08 1.88 ± 0.45 1.22 ± 0.19 0.87 ± 0.09 bn140701567 1.61E-06 ± 2.73E-08 2.21 ± 0.62 1.28 ± 0.23 0.98 ± 0.11 bn140701833 1.53E-06 ± 2.80E-08 8.55 ± 0.78 6.75 ± 0.36 4.01 ± 0.14 bn140703026 4.33E-06 ± 2.90E-08 2.66 ± 0.46 2.23 ± 0.21 1.97 ± 0.10 bn140705539 1.71E-06 ± 2.59E-08 1.76 ± 0.45 0.87 ± 0.16 0.80 ± 0.08 bn140706815 1.32E-06 ± 4.12E-08 1.47 ± 0.40 1.05 ± 0.20 0.72 ± 0.09 bn140709051 3.99E-06 ± 8.52E-08 2.44 ± 0.55 1.78 ± 0.26 1.47 ± 0.12 bn140709637 4.21E-06 ± 3.40E-08 1.73 ± 0.40 1.19 ± 0.18 0.87 ± 0.08 bn140710537 2.10E-07 ± 3.82E-09 4.63 ± 0.86 2.68 ± 0.33 0.93 ± 0.13 bn140710901 6.20E-07 ± 2.91E-08 1.34 ± 0.48 0.72 ± 0.23 0.46 ± 0.09 bn140711691 1.55E-06 ± 7.25E-08 1.71 ± 0.49 0.86 ± 0.21 0.45 ± 0.10

– 225 –