arXiv:1603.05674v1 [astro-ph.SR] 17 Mar 2016

PARALLAX RESULTS FROM URAT EPOCH DATA

Charlie T. Finch, Norbert Zacharias

finch@usno.navy.mil

U.S. Naval Observatory, Washington DC 20392–5420

ABSTRACT

We present 1103 trigonometric parallaxes and proper motions from the United States Naval Observatory (USNO) Robotic Astrometric Telescope (URAT) observations taken at the Naval Observatory Flagstaff Station (NOFS) over a 3 year period from April 2012 to June 2015 covering the entire sky north of about −10^∘ declination. We selected 2 samples: previously suspected nearby stars from known photometric distances and stars showing a large, significant parallax signature in URAT epoch data wihtout any prior selection criteria. All systems presented in this paper have an observed parallax ≥ 40 mas with no previous published trigonometric parallax. The formal errors on these weighted parallax solutions are mostly between 4 and 10 mas. This sample gives a significant (order 50%) increase to the number of known systems having a trigonometric parallax to be within 25 pc of the Sun (without applying Lutz-Kelker bias corrections). A few of these are found to be within 10 pc. Many of these new nearby stars display a total proper motion of less than 200 mas/yr. URAT parallax results have been verified against Hipparcos and Yale data for stars in common. The publication of all signifigant parallax observations from URAT data is in preparation for CDS.

Subject headings: parallaxes — solar neighborhood — stars: distances — stars: statistics — surveys — astrometry — photometry

1. INTRODUCTION

Due to the proximity to the Sun, nearby stars are excellent candidates for multiplicity, stellar activity, ages and exoplanet research. A comprehensive census of nearby stars is needed to investigate the luminosity and mass function of the solar neighborhood.

Trigonometric parallax is the most direct and accurate method to determine stellar distances requiring only the Earth’s orbital motion and multiple epoch astrometric observations of the target star. This greatly reduces confusion or bias that may be present in other methods that rely on specific properties or prior knowledge about the star.

The primary source for trigonometric parallaxes are the Yale Parallax Catalog (YPC)

(van Altena et al. 1995) containing 8112 stars with a faint limit of V = 21.5 magnitudes and the Hipparcos catalog (ESA 1997) containing 118218 stars with a faint limit of V ≈ 13 mag. The Hipparcos new reduction (van Leeuwen 2007) contains 117955 stellar parallaxes. Due to the magnitude limit of the Hipparcos catalog with completeness between V 7.3 and 9.0 mag (dependent on galactic latitude and spectral type) (Perryman et al. 1997) and the limited number of stellar parallaxes from YPC, many nearby stars have yet to be discovered. Some recent ground based efforts include the Research Consortium On Nearby Stars (RECONS) (Jao et al. 2005; Henry et al. 2006; Subasavage et al. 2009; Riedel et al. 2010, 2014; Jao et al. 2011), USNO (Dahn et al. 2002; Vrba et al. 2004), and MEarth

(Dittmann et al. 2014) along with many others which have been trying to fill in the gaps before Gaia data becomes available.

For this study we take the recently completed Northern Hemisphere observing from the United States Naval Observatory (USNO) Robotic Astrometric Telescope (URAT). This data include all individual exposures from April 2012 to June 2015 giving a longer epoch baseline for determining parallaxes over the 2-year span of the First USNO Robotic Astrometric Telescope Catalog (URAT1) (Zacharias et al. 2015) published data (see § 2). We use previous proper motion surveys utilizing the Digitized Sky Survey (DSS) in the northern sky (Lépine 2005), the SuperCOSMOS Sky Survey in the southern sky (Subasavage et al. 2005; Winters et al. 2011; Boyd et al. 2011; Winters et al. 2015), and the USNO CCD Astrograph Catalog (UCAC) (Finch et al. 2010, 2012b, 2014) to identify stars previously anticipated to be within 25 pc using other methods, like photometric distances(see § 4.2). For these stars we obtain trigonometric parallaxes for the first time using URAT data.

In addition, we also use the entire URAT Northern Hemisphere observations to look for previously unknown nearby stars within 25 pc of the Sun, independent of any selection criteria other than the trigonometric parallax signature in the URAT data (see § 4.3). This task is difficult due to the relatively short epoch span and moderate accuracy of our URAT observations and the presence of contamination from e.g. unknown multiplicity of stars and statistical biases.

2. OBSERVATIONS

All URAT sky survey observations were taken close to the meridian (hour angle typically within ±5^∘). Each observing night is split into 5 equal long periods during which a different set of 3 dither positions of a field are observed, thus providing good parallactic angle distribution over the course of a year. A 60 and 240 second exposure is taken at each individual telescope pointing. The entire pattern is repeated with 10 and 30 second exposures with an objective grating near full moon. This vastly expands the dynamic range of the URAT survey toward bright stars, covering the entire range between about R = 4 and 18 magnitudes. URAT observes through a single filter (part of the dewar window) to provide a fixed bandpass of about 680 to 760 nm.

The clear aperture of the USNO astrograph is 206 mm with a focal length of only 2 m. A single exposure covers 28 square degrees with a resolution of 0.9 arcsecond/pixel. Each of the 4 large CCDs in the focal plane covers a 2.65 by 2.65 deg area on the sky. Data of all 3 years of operations (April 2012 to June 2015) at the USNO Flagstaff Station (NOFS) are used here for this parallax investigation. For more details about the project, instrument and observing the reader is referred to the URAT1 paper (Zacharias et al. 2015).

3. ASTROMETRIC REDUCTIONS

3.1. Raw Data Processing

Custom code was used to apply overscan, trim, dark and flat-field corrections operating on 2-byteinteger FITS files for both the raw data and processed images. Custom code was also used to detect stellar images (4-sigma above background threshold) and perform 2-dim spherical symmetric Gaussian model profile fits to the observed stellar images of the processed pixel data. Besides the seeing, a significant contribution to the observed point spread function (PSF) comes from diffraction due to the relatively small aperture, leading to an observed image profile width of typically 2 pixels full width at half maximum (FWHM). The PSF is very uniform across the entire field of view, thus the same model function was used independent of the location of a stellar images in the focal plane.

3.2. Astrometric Solution

An 8-parameter ’plate’ model was adopted for the astrometric reductions (linear + tilt terms) using the Fourth USNO CCD Astrograph Catalog (UCAC4) (Zacharias et al. 2013) for reference stars, restricted to magnitudes R = 8 to 16. A weighted, least-squares solution with outlier rejection was performed on each individual CCD and exposure with typically several hundred to a few thousand reference stars per astrometric solution. The data are corrected for geometric field distortions (about 10 to 60 mas effect) and pixel phase errors (0 to 15 mas) using ’look-up’ tables generated from preliminary reductions and residual analysis.

Individual epoch positions (α, δ) of all stars were obtained on the International Celestial Reference System (ICRS) via UCAC4. Depending on brightness and exposure time typical positional errors of individual observations are 10 to 60 mas. All individual epoch positions have been matched to individual stars with mean data and indexing saved to a separate, large file allowing fast, direct access to the individual observations (42 bytes of binary data each). These URAT data consists of over 392 million individual objects with about 8.4 billion observations. Excluding single detections, the average number of observations per star is about 24. For more details about the astrometric reductions the reader is referred to the URAT1 paper (Zacharias et al. 2015).

3.3. Solving For Parallax

The URAT parallax pipeline utilizes routines from (Jao 2004), the JPL DE405 ephemeris and Green’s parallax factor (Green, R. M. 1985) for determining parallaxes. We first determined the location of the Earth (rectangular coordinates X, Y , and Z) at each URAT mid exposure using the JPL DE405 ephemeris. This was done so that the pipeline can be run over all epoch data of all stars and look up the Earth’s position by exposure number instead of re-calculating these data for each star and epoch, thus significantly reducing the run time of the code. The rectangular coordinates at epoch are then used to determine the parallax factors using the following formulae:

P_α = X sin α − Y cos α (1)

P_δ = X cos α sin δ + Y sin α sin δ − Z cos δ (2)

The parallax factors of all individual data are then used to simultaneously solve for mean position, proper motion and parallax using all ’good’ epoch data of a given star in a least-squares adjustment with outlier rejection from the following equations:

x(t) = x(t_0) + μ_x(t − t_0) + πP_α (3)

y(t) = y(t_0) + μ_y(t − t_0) + πP_δ (4)

Where x(t), y(t) are the positions of a given star on the tangential plane as function of time (t), π is the parallax, μ_x = μ_αcosδ and μ_y = μ_δ represent the proper motions in RA and DEC, respectively. The initial instant of time (t_0) can be chosen arbitrarily. Here we choose the first observing epoch as zero point for x, y and t.

In Table 1 we show the cuts we have adopted to the URAT epoch data of a given star when solving for parallax. The limits imposed on individual image amplitude, image profile width (FWHM) and position fit error (sigma) are set to not allow saturated stars, stars with too few photons or poorly determined positions to be used in the parallax solution. Limits on number of individual observations used and epoch span were adopted empirically to obtain ’good’ results when comparing the URAT parallaxes with the Hipparcos Catalog and the Yale Parallax Catalog and at the same time allow for as many as possible ’reasonable’ parallax solutions from our data.

In the least-squares adjustment to solve for parallax (eqs. 3 and 4) weights were used according to the precision of individual observations which can vary largely due to the different exposure times and amplitudes of individual observations. An error floor of 10 mas was added in quadrature to the random errors (in the astrometric reductions of individual observations) before calculating the weights for an observation in determining the parallax (see (Zacharias et al. 2015) for details about the astrometric reductions of individual observations). A 3-sigma outlier rejection criteria was imposed and in cases where the post-fit error of unit weight exceeded 1.5 times the expected error of the fit solution the largest residual(s) were iteratively removed from the fit solution. This way typically up to a few percent of observations were rejected for the parallax solution of individual stars.

3.4. Conversion From Relative To Absolute Parallax

At this point we have parallaxes for the target stars that are relative to the set of reference stars used in the reductions of the URAT positions, i.e. with respect to typically many hundreds to a few thousand stars in a 2.65 by 2.65 square degree area of a single URAT CCD detector. To convert from relative to absolute parallax we use photometric parallaxes for the reference stars. This method is not as reliable as spectroscopic parallaxes which can determine the spectral type and luminosity class, allowing to apply correct Mvcolor relations to each reference star. Photometric parallaxes were used because of the lack of spectroscopic data for millions of stars in our survey area down to R = 16 mag.

Again we use the UCAC4 catalog here now also for its photometric data. This was done by picking the same UCAC4 stars previously used as reference stars in the astrometric reductions (R = 8 to 16 mag). These stars are then run through our 16 photometric color-M_{Ks} relations (Finch et al. 2014) which use the AAVSO Photometric All-Sky Survey (APASS) BV gri and Two Micron All Sky Survey (2MASS) JHK_s photometry included in the UCAC4 catalog. Using this data we determine a mean photometric parallax per reference star, assuming all stars are main-sequence due to the lack of information for each star. This is done for all reference stars in a 2 by 2 degree wide area around each target star to determine a mean absolute parallax correction for each target star. The average parallax correction for the target stars in this paper is 1.3 mas varying from 0.5 to 6.6 mas depending on the field. For any star having an unknown correction, we use the mean to convert to absolute parallax. For stars having a correction greater than three times the average (≥ 3.9 mas) we adopt this as a cutoff and use 3.9 mas to convert to absolute parallax. For these stars we have added a note in the tables to indicate if the mean or cutoff correction was used. Considering the relatively large random errors of our parallax results, this step is not critical for the goal of our investigation.

3.5. Biases

We do not apply any corrections to our parallaxes for the Lutz-Kelker bias (Lutz & Kelker 1973) because we don’t draw conclusions about completeness of a distance limited sample or interpret results regarding absolute luminosity. This is beyond the scope of this paper which is to present the observed trigonometric parallaxes for a large number of stars. This bias comes into play when ”translating” the observed parallax into distances and absolute luminosities.

4. RESULTS

The URAT parallax pipeline as described above was run over the entire set of URAT observational epoch data resulting in 44.7 million parallax solutions. These results were then matched with the Hiparrcos catalog, YPC, SIMBAD database (Wenger et al. 2000) and other trigonometric parallax published data using a 60 arcsecond radius to flag stars with previously published trigonometric parallaxes. Results for nearby stars and no prior published trigonometric parallax were extracted from this pool of data, while for most of those millions of stars our parallax solution is not significant due to the large distance of most stars and our relatively large random observational errors.

4.1. Comparison To Published Parallaxes

The Hipparcos Catalog contains 65546 stars north of −10^∘ declination. While the URAT catalog goes as far south as about δ = −24^∘ its completeness begins to drop south of −10^∘ declination. The URAT catalog recovers 65524 (99.96%) of Hipparcos stars in this area of the sky. Most of the few missed stars are just brighter than the URAT limit or lost due to blended images which are not taken care of in the URAT reductions.

One of the main goals of this paper is to discover new nearby stars or confirm candidates within 25 pc. To determine how well URAT can detect stars within 25 pc we used the Hipparcos catalog (2007 version). Hipparcos contains 926 stars north of −10^∘ declination with a parallax ≥ 40 mas. URAT recovers 887 (= 95.8%) of the Hipparcos 25 pc sample loosing 20 from our amplitude/sigma cuts, 16 having too short of an observational epoch span, 3 having too few observations and 6 stars not being in the URAT data at all. Of those 887 recovered stars, 778 (= 87.7%) have a URAT parallax ≥ 32 mas. In Figure 1 we show the comparison between the Hipparcos 25 pc sample and URAT results, where the center line indicates agreement and the 2 outer lines indicate a 10 mas difference from the Hipparcos parallax values.

In order to investigate how reliabel the URAT parallax formal errors are, we took the 25 pc sample of 887 stars common to Hipparcos and applied 2 different cases of cuts to filter ”reasonably good” data. Selection criteria and results are summarized in Table 2. The number of observations per target star, the epoch span of these observations and the formal errors of both the Hipparcos and our URAT data were restricted. For the stars remaining in the sample the unweighted difference in parallax was calculated. A few outliers were further eleminated at this stage (see Table 2) before the RMS of the parallax difference and the formal errors were calculated. We see that formal errors on our URAT parallaxes are underestimated by about 10 to 20% when compared to the observed scatter of the data (the errors for the Hipparcos parallaxes are much smaller, typically 0.5 to 2 mas, than the URAT parallax errors). Distributions of the URAT parallax formal errors are shown in Figures 2 and 3 for the Hipparcos 25 pc sample and all Hipparcos stars north of −10^∘ declination, respectively. This shows that the URAT errors for these samples peak around 8 mas with typical errors between 4 and 15 mas.

In Figure 4, we show the relation between the URAT parallax error and epoch difference of the available URAT data for the Hipparcos 25 pc sample. For Figure 5, we use the same sample but show the relationship between the URAT parallax error and number of observations. These plots indicate that the URAT parallax errors drop below about 8 mas for solutions having an epoch span greater than 2.0 years and more than 40 individual epochs.

Hipparcos and YPC have 698 stars in common north of δ = −10^∘ with a V magnitude range of 2.83 to 11.70. Of these 698 stars, we obtained a URAT parallax for 696 stars. Figures 6, 7 and 8 show the comparison of URAT vs. Hipparcos, URAT vs. YPC and YPC vs. Hipparcos, respectively. The center line indicates perfect agreement while the two outer lines have been added to show a difference of 10 mas. URAT compares relatively well with both the Hipparcos and YPC results, but does show a somewhat larger scatter not present in the YPC vs. Hipparcos plot, as expected from mean formal errors.

A similiar parallax investigation was completed using images from the MEarth photometric survey (Dittmann et al. 2014) having a large overlap with our URAT parallaxes. The typical error on the MEarth parallax data is reported to be 4 mas, while that for URAT data is about twice as large. In Figure 9, we compare the parallax results reported in (Dittmann et al. 2014) for the

572 stars matched with the URAT parallax data. The center line represents perfect agreement while the outer lines show a ± 10 mas difference.

In Figure 10 we show a comparison between URAT and 1387 published trigonometric parallaxes ≥ 40 mas from the 11878 parallaxes described in § 4.3 pulled from the 44.7 million parallaxes from the entire URAT data. A 60 arcsecond radius was used when searching SIMBAD, published papers and vizeir for published trigonmetric parallaxes.

4.2. New Trigonometric Parallaxes of Photometric Sample

We first took a list of 9737 nearby stars having previously published distance estimates based on photometry from the publications listed in § 1. After cutting these to the area of sky being searched in this survey (δ ≥ −10^∘) we are left with 4853 candidate nearby stars. These are then run through our parallax pipeline and list of constraints resulting in 3093 parallax results. These constraints include the same as listed in Table 1 with an additional constraint to the parallax error to be ≤ one half the parallax and ≤ 25 mas. Of the remaining 3093 stars, 1906 were found to not have a published parallax result after searching SIMBAD, Vizier and published papers. After removing 182 duplicate entries which came from combining all systems from the published papers we are left with 1724 parallax results. We then only keep the 545 stars having a URAT parallax ≥ 40 mas which is the focus of this paper. Of these 545 stars 10 have a URAT parallax ≥ 100 mas.

Data for all these 545 stars (picked from photometric list and having a URAT prallax distance within 25 pc) are given in Table 3 (sorted by parallax). We include the names, RA and Dec coordinates (at epoch 2014.0 on the ICRS; derived from input data in corresponding published paper), URAT magnitude, epoch span, number of observations, number of rejected observations, absolute parallax, parallax error, parallax correction, proper motion in RA and Dec with associated errors, and JHK_sBV gri photometric data from UCAC4 along with any notes. All 545 stars have no previous published trigonometric parallax. The average formal parallax error for this sample is 7.8 mas. Notes on specific individual stars from this sample are reported in § 5.

In Figure 11, we compare the URAT trigonometric parallax to the previously published photometric parallaxes for the 545 stars in this sample. In Figure 12, we show an example of a good fit for G165-058 (π = 80.1 ± 4.4 mas, pmra = 6.4 ± 2.8 mas/yr, pmdc = 298.1 ± 2.7 mas/yr). This plot shows all URAT epoch data for this star. A histogram of the parallax error for this sample is given in Figure 13, showing the peak around 6 mas with the majority of the errors falling in the 4 to 10 mas range. In Figure 14 we present a histogram of total proper motions for the same sample which shows a significant number of nearby stars with small proper motions (between 100 and 450 mas/yr). The errors for this sample are somewhat smaller than for the Hipparcos and YPC sample used above due to the more stringent restrictions applied here.

4.3. New Trigonometric Parallaxes Without Prior Selection

The entire URAT data was run through the parallax pipeline giving 44.7 million parallax solutions. We then implemented several cuts to get this to a more manageable sample, keeping only stars with: 1) a parallax ≥ 40 mas, 2) epoch span of at least 1.5 years, 3) at least 30 individual epochs, 4) parallax error ≤ 20 mas and ≤ onefourth the absolute parallax. These cuts left us with a sample of 6571 new candidate nearby stars. We then used SIMBAD, Vizeir and published papers to remove 1753 stars having a previous published parallax or having a match with Table 3, leaving us with 4818 nearby star candidates. Of these new nearby star candidates 35 have a URAT parallax ≥ 100 mas.

The current URAT reduction process does not take provisions for close doubles (blended images) of arcsecond-level separations. Many of our candidates, particularly those with large parallax solution errors are possibly blended images. This means a visual inspection (residual plots as well as real sky image using Aladin) must be completed to verify the integrity of the solution. This would not be practical for the entire sample.

However, this visual inspection was completed for the 35 candidate stars in our 10 pc sample. For this sample we find the majority of the stars are blended or elongated even if the fit solution looks reasonable. All stars considered ’suspect’ from this visual inspection are flagged. In Figure 15, we show an example of a poor fit case for the star UPM 1304+8611 (π = 42.5 ± 7.3 mas, pmra = 40.1 ± 8.6 mas/yr, pmdc = -33.4 ± 8.4 mas/yr), which is marked as suspect in our table. This plot shows all URAT epoch data for this star similarly to the previous Figure.

While sifting through the 10 pc nearby star sample we notice UPM2340+4631, and UPM2340+4625 both have large parallaxes with a separation less than 7 arcminutes. We also notice that UPM1758-0055, UPM1758-0057, UPM1758-0058 and UPM1758-0104 also share a large parallax and are all separated by less than 12 arcminutes, indicating they may all be part of the same group. More information on these stars are reported in § 5.

For the remaining 4783 stars comprising of nearby star candidates between 10 and 25 pc, we were not able to search the entire sample. Instead we sorted the list by 1) number of epochs, 2) parallax error and 3) image elongation in that order. We then started visually checking the fits to verify the quality. During this process we also randomly looked at sky images using Aladin. For this sample we did not see any examples of an elongated or blended image in our random search. The fits for this sample also seemed of higher quality than the 10 pc sample however, we did see some fits which might be suspect which are noted in the table. We were able to search 1221 of the 25 pc nearby star candidates that we felt had the highest chance of being a real nearby star with a quality parallax solution.

This search produced 558 new discoveries within 25 pc of the Sun, of which 24 have a URAT parallax putting them within 10 pc. All of the fits and sky images have been visually inspected for the 10 pc sample. For new discoveries between 10 and 25 pc all fits have been visually inspected and sky images randomly inspected for issues.

In Table 4, we present details for the 558 new nearby stars having an absolute parallax ≥ 40 mas (sorted by parallax). These stars have no previously published photometric distance or trigonometric parallax information. We have added a note in the table to indicate if the sky image was found to be elongated, blended or the fit suspect. We include the names, RA and Dec coordinates (ICRS epoch 2014; derived from the mean URAT position at mean epoch from all epochs used in the fit along with the URAT proper motions), URAT magnitude, epoch span, number of observations, number of rejected observations, absolute parallax, parallax error, parallax correction, proper motion with associated errors, and JHK_sBV gri photometric data from the URAT1, along with notes. We have given a USNO Proper Motion (UPM) name for the 281 entries having no previous proper motion information reported from SIMBAD. The average absolute parallax error for this sample is 6.3 mas. Details about individual stars are reported in § 5.

We present a histogram of the parallax error for this sample in Figure 16, showing the peak around 5 mas with the majority of the errors falling in the 4 to 8 mas range. In Figure 17 we show a histogram of total proper motions for the same sample which shows the majority of the new nearby star discoveries have small proper motions (less than 200 mas/yr. The errors for this sample are the smallest out of any other sample due to the most stringent selection criteria applied here for searching the best possible nearby star candidates.

5. NOTES ON INDIVIDUAL SYSTEMS

TYC 3980-1081-1 having a V magnitude of 10.5 is the closest confirmed star in this sample at 6.46 pc (π = 154.8 ± 12.1 mas, pmra = -21.0 ± 13.6 mas/yr, pmdc = 149.5 ± 13.7 mas/yr), making this the 97th nearest star system to the Sun. The new URAT parallax is slightly farther than the photometrically estimated distance of 5.9 pc from the UCAC4 nearby star survey paper (Finch et al. 2014). This star shows no signs of elongated or blended image and no issues are seen with the fit solution. Our measurements suggest that this would be the 97th closest star system according to the Research Consortium On Nearby Stars (RECONS)^1 100 nearest star systems.

UPM 0012+5215 having a URAT magnitude of 15.62 is the third closest new discovery in this sample at 6.48 pc (π = 154.3 ± 17.3 mas, pmra = 42.6 ± 14.5 mas/yr, pmdc = 46.2 ± 14.0 mas/yr). Our measurements suggest that this would be the 99th nearest star system to the Sun. The sky image of this star did show a blended image and has

1www.recons.org

been noted as suspect in Table 4, indicating the solution may be erroneous.

UPM 2340+4625 having a URAT magnitude of 14.93 is the second closest new discovery in this sample at 4.8 pc (π = 206.5 ± 17.3 mas,pmra = 48.5 ± 12.3 mas/yr, pmdc = 42.0 ± 12.0 mas/yr). Our measurements suggest that this would be the 44th nearest star system to the Sun. The sky image of this star does show an elongated image and the solution has been noted as suspect in Table 4. However this star shares a large parallax with UPM 2340+4631 (within 2 sigma of each other) at a separation less than 7 arcminutes away indicating it may be a binary. The sky image of UPM 2340+4631 does show an elongated image and has been noted as suspect in Table 4, indicating the solution may be erroneous.

UPM 0429+3806 having a URAT magnitude of 15.36 is the closest new discovery in this sample at 4.4 pc (π = 227.2 ± 19.0 mas, pmra = 114.7 ± 14.0 mas/yr, pmdc = 3.8 ± 13.0 mas/yr). Our measurements suggest that this would be the 34th nearest star system to the Sun. The sky image of this star did show an elongated image and has been noted as suspect in Table 4 indicating the solution may be erroneous.

UPM 1758-0058, UPM 1758-0057, UPM 1758-0055 and UPM 1758-0055 all share a large parallax (π = 103.2 ± 18.4 mas, 110.6 ± 18.9 mas, 103.5 ± 22.0 mas, 109.5 ± 23.3 mas) within 1 sigma respectively at a separation less than 12 arcminutes on the sky and all with small proper motions. None of the sky images for these stars have been tagged as having a blended or elongated image. However these stars have been tagged as suspect in Table 4 due to scatter seen in the fits indicating the solutions may be erroneous.

6. CONCLUSIONS

Parallaxes from URAT data are as good as can be expected considering that this is a wide-angle, all-sky survey using a telescope with only 2 m focal length and relatively short epoch span of about 3 years. This is the largest trigonometric parallax survey conducted since the Hipparcos mission and before PanSTARRS and Gaia results become available.

Contrary to dedicated trigonometric parallax programs the observations of all target stars of our URAT data are scattered all over the focal plane on different CCDs and different areas of the CCDs, even with largely different image amplitudes due to the use of 10 to 240 sec exposures. Thus potential magnitude dependent systematic errors and geometric field distortions must have been successfully removed from the URAT data to insignificant levels, else the obtained parallax results would have shown larger errors.

Although a formal trigonometric parallax solution from URAT data could be obtained for over 40 million stars, only a small fraction of those are significant due to the modest precision, limited number of observations and epoch span and lack of double star fitting in the URAT data. However, many accessible stars within 10 and 25 pc can reliably be detected independent of any preselections, just based on the observed trigonometric parallax signature in the URAT data.

A large number (545) nearby star candidates in the sky area north of δ = −10^∘ have been confirmed with URAT trigonometric parallaxes to be within 25 pc of the Sun. A significant number (558) of new nearby stars have been discovered from this survey.

In Figure 18, we show the location on the sky of the entire 1103 star sample from Tables 3 and 4. The distribution is relatively uniform over the area of our survey showing no ’clumps’.

There is a significant overlap of targets between the MEarth project and the URAT survey, however, the MEarth project is limited to very red, pre-selected M dwarfs, while the URAT survey has no such selection bias. This explains the fair number of additional nearby stars discovered in the URAT data.

Interestingly in Figure 17, we show a significant number of nearby stars with small proper motions (less than 200 mas/yr often adopted for high proper motion stars) indicating more nearby stars hiding in the slower proper motion regime.

As of 01 January 2014, there are 2168 systems known all-sky within 25 pc, of which 270 systems are known to be within 10 pc that have accurate trigonometric parallaxes (Finch et al. 2014). The total number (1103) of confirmed and new nearby stars from our URAT survey constitutes a total increase of 51% of the previously known nearby star sample in this distance range and sky area. The 33 stars with a reported URAT parallax ≥ 100 mas in this paper constitutes an increase of 12% of the previously known 10 pc sample. All stars reported in this survey have no previously known trigonometric parallax. The real fraction of stars added to the 10 pc and 25 pc samples by our survey will be somewhat smaller due to Lutz-Kelker bias and parallax solution fit statistical bias.

A catalog of all significant parallaxes as obtained from URAT regardless of prior publications is in preparation for CDS. This will include our measures of stars also found in Hipparcos, YPC, MEarth and other projects and will go beyond the 40 mas limit adopted for this paper.

We thank the entire URAT team for making this nearby star search possible. Special thanks go to Wei-Chun Jao and members of the RECONS team for help with the parallax pipeline. This work has made use of the SIMBAD, VizieR, and Aladin databases operated at the CDS in Strasbourg, France. We have also made use of data from 2MASS, APASS, and the ADS service as well as the PGPLOT plotting software. We also would like to thank the many people who contributed to our custom astrometric software code, some of which dates way back e.g. (de Vegt 1969). We also benefit from the fact that Fortran code is backwards compatible allowing us to mix recent code with original, unchanged code written over the past 50 years.

REFERENCES

Boyd, M. R., Winters, J. G., Henry, T. J., et al.

2011, AJ, 142, 10

Dahn, C. C., Harris, H. C., Vrba, F. J., et al. 2002, AJ, 124, 1170

de Vegt, C. 1969, AN 290, 261

Dittmann, J. A., Irwin, J. M., Charbonneau, D., & Berta-Thompson, Z. K. 2014, ApJ, 784, 156

Finch, C. T., Zacharias, N., & Henry, T. J. 2010, AJ, 140, 844

Finch, C. T., Zacharias, N., Boyd, M. R., Henry, T. J., & Hambly, N. C. 2012b, ApJ, 745, 118

Finch, C. T., Zacharias, N., Subasavage, J. P., Henry, T. J., & Riedel, A. R. 2014, AJ, 148, 119

, Spherical Astronomy, Cambridge University Press Henry, T. J., Jao, W.-C., Subasavage, J. P., et al.

2006, AJ, 132, 2360 Lépine, S. 2005, AJ, 130, 1680 Lutz, T.E. & Kelker, D.H. 1973, PASP, 85, 573 Perryman, M. A. C., Lindegren, L., Kovalevsky, J., et al. 1997, A&A, 323, L49 Riedel, A. R., Subasavage, J. P., Finch, C. T., et al. 2010, AJ, 140, 897 Riedel, A. R., Finch, C. T., Henry, T. J., et al.

2014, AJ, 147, 85 Skrutskie, M. F., Cutri, R. M., Stiening, R., et al.

2006, AJ, 131, 1163 Subasavage, J. P., Henry, T. J., Hambly, N. C., et al. 2005, AJ, 130, 1658 Subasavage, J. P., Jao, W.-C., Henry, T. J., et al.

2009, AJ, 137, 4547 van Altena, W. F., Lee, J. T., & Hoffleit, E. D.

1995, New Haven, CT: Yale University Observatory, —c1995, 4th ed., completely revised and enlarged, van Leeuwen, F. 2007, A&A, 474, 653 Vrba, F. J., Henden, A. A., Luginbuhl, C. B., et al. 2004, AJ, 127, 2948 Wenger, M., Ochsenbein, F., Egret, D., et al. 2000, A&AS, 143, 9 Winters, J. G., Henry, T. J., Jao, W.-C., et al.

2011, AJ, 141, 21 Winters, J. G., Henry, T. J., Lurie, J. C., et al.

2015, AJ, 149, 5 ESA 1997, ESA Special Publication, 1200, Jao, W.-C. 2004, Ph.D. Thesis, 6433 Jao, W.-C., Henry, T. J., Subasavage, J. P., et al.

2005, AJ, 129, 1954 Jao, W.-C., Henry, T. J., Subasavage, J. P., et al.

2011, AJ, 141, 117

Zacharias, N., Finch, C. T., Girard, T. M., et al.

2013, AJ, 145, 44 Zacharias, N., Finch, C., Subasavage, J., et al.

2015, AJ, 150, 101

This 2-column preprint was prepared with the AAS L^ATEX macros v5.2.

Fig. 1.— Parallax comparison between URAT and the Hipparcos 25 pc sample north of δ = −10^∘. The center line represents perfect agreement while the outer lines show a ± 10 mas difference.

Fig. 2.— Histogram plot of URAT parallax errors for the stars in the Hipparcos 25 pc sample north of δ = −10^∘.

Fig. 3.— Histogram plot of URAT parallax errors for the 63238 stars in the Hipparcos sample north of δ = −10^∘

Fig. 4.— Relationship between URAT parallax errors and epoch span coverage for the Hipparcos 25 pc sample north of δ = −10^∘.

Fig. 5.— Relationship between URAT parallax errors and number of observations for the Hipparcos 25 pc sample north of δ = −10^∘.

Fig. 6.— Comparison between URAT and Hipparcos parallaxes for stars in common with YPC north of δ = −10^∘. The center line represents perfect agreement while the outer lines show a ± 10 mas difference.

Fig. 7.— Comparison between URAT and YPC parallaxes for stars in common with Hipparcos north of δ = −10^∘. The center line represents perfect agreement while the outer lines show a ± 10 mas difference.

Fig. 8.— Comparison between YPC and Hipparcos parallaxes for stars in common with URAT north of δ = −10^∘. The center line represents perfect agreement while the outer lines show a ± 10 mas difference.

Fig. 9.— Comparison between URAT and the MEarth project (Dittmann et al. 2014) parallaxes for the 572 stars in common. The center line represents perfect agreement while the outer lines show a ± 10 mas difference.

Fig. 10.— Comparison between the URAT 25 pc sample and published trigonometric parallaxes of 1387 stars in common. The center line represents perfect agreement while the outer lines show a ± 10 mas difference.

Fig. 11.— Comparison between the photometric and URAT parallax for the 545 stars without previously published trigonometric distance with π ≥ 40 mas and δ ≥ −10^∘. The center line represents perfect agreement while the outer lines show an RMS combined error of 20% (photometric distance error) and 10 mas (trigonometric parallax error).

Fig. 12.— Example of a good fit from our parallax pipeline. This fit is for star G165-058 (π = 80.1 ± 4.4 mas, pmra = 6.4 ± 2.8 mas/yr, pmdc = 298.1 ± 2.7 mas/yr) showing in the top left the RA offset vs. Dec offset [arcsecond], top right the parallactic ellipse, bottom left, Dec offset over time and bottom right RA offset over time.

Fig. 13.— Histogram of the URAT parallax errors for the 545 stars having previous photometric distance estimates north of δ = −10^∘.

Fig. 14.— Histogram of the URAT total proper motion for the 545 stars having previous photometric distance estimates north of δ = −10^∘.

Fig. 15.— Example of a poor fit from our parallax pipeline. This fit is for UPM 1304+8611 (π = 42.5 ± 7.3 mas, pmra = 40.1 ± 8.6 mas/yr, pmdc = -33.4 ± 8.4 mas/yr), which is marked as suspect in our table. This plot shows all URAT epoch data for this star similarly to Figure 12.

Fig. 16.— Histogram of the URAT parallax errors for the 558 new discoveries in our sample.

Fig. 17.— Histogram of the URAT total proper motion for the 558 new discoveries in our sample.

Fig. 18.— Distribution on the sky of all 1103 stars reported in this paper.

Table 1 Adopted cuts for the URAT epoch data

CUT ITEM LOW HIGH

FWHM · · · 7.0 Amplitude 500 30000 sigma x [mas] · · · 90.0 sigma y [mas] · · · 90.0 numb. observ. used 10 · · · epoch span [year] 0.5 · · ·

Table 2 Summary of URAT formal error investigation

ITEM case 1 case 2

low limit number of observations 20 30 upper limit error URAT par. [mas] 20.0 12.0 upper limit error Hip. par. [mas] 4.0 3.0 lower limit epoch span [year] 1.5 2.0 number of stars in sample 520 357 upper limit par.difference [mas] 30.0 25.0 number of stars remaining 511 347 RMS of parallax difference [mas] 11.3 10.2 RMS of formal errors [mas] 10.2 8.4

Table 3 New trigonometric parallaxes for stars having previous photometric distance estimates

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

TYC 3980-1081-1 327.9090744 59.2944419 10.81 1.96 39 0 154.8 12.1 1.9 -21.0 13.6 149.5 13.7 6.529 5.860 5.651 11.958 10.501 11.185 9.980 8.600 LHS 6167 138.9001086 -10.5972033 11.66 1.13 35 0 134.9 12.1 0.9 -393.7 14.7 -200.8 14.7 8.605 8.074 7.733 15.643 13.804 14.569 13.133 11.093 TYC 2187-512-1 320.5266342 22.9319081 9.39 1.31 20 0 109.3 19.1 1.0 131.4 28.1 120.0 20.0 7.400 6.800 6.595 12.021 10.555 11.336 9.980 9.103 LP688-003 263.5356092 -8.8323381 13.82 2.10 18 0 108.0 21.8 3.9 -171.5 7.7 -293.1 7.7 10.905 10.400 10.055 · · · · · · · · · · · · · · · a TYC 3251-1875-1 3.9121606 47.5893683 9.59 2.12 58 0 104.9 9.6 1.2 -95.8 11.7 -5.5 11.8 7.336 6.709 6.467 12.605 11.120 11.804 10.511 9.234 2MASS J07171706-0501031 109.3229025 -5.0193367 11.47 2.24 51 0 104.6 7.9 1.3 424.7 5.8 -396.4 5.7 8.873 8.349 8.045 14.716 13.224 13.928 12.608 11.067 G 184-31 282.4765197 18.6735653 12.18 3.04 82 0 104.4 7.2 1.5 -97.8 4.0 -277.7 3.9 9.380 8.815 8.509 14.881 13.619 14.209 13.109 11.702 G 97-20 76.9555769 17.9816078 10.30 2.18 41 1 101.9 6.0 1.4 61.2 6.0 -265.8 6.0 8.023 7.446 7.178 13.434 11.809 12.606 11.185 9.924 LTT 07077 266.6223942 -8.7120364 10.89 2.11 38 0 104.3 17.1 3.9 -50.0 8.7 -415.3 8.7 8.198 7.693 7.353 14.408 12.706 13.451 11.999 10.540 a LHS 2232 153.1422206 57.0615525 10.12 2.34 88 0 98.2 6.1 1.0 -347.9 6.4 -528.0 6.4 · · · · · · · · · 13.380 11.731 12.522 11.134 9.728 G161-071 146.2244347 -12.3481969 11.68 1.22 14 0 96.1 15.9 1.0 -338.1 32.2 2.8 29.4 8.496 7.919 7.601 15.366 13.750 14.495 13.125 11.174 G 41-8 134.0813169 12.6627489 12.44 2.94 50 0 95.2 6.5 1.0 -41.2 4.9 -240.1 4.5 9.585 9.033 8.708 16.295 14.480 15.239 13.810 12.006 LEP 1809-0219 272.4321889 -2.3283383 13.13 3.00 35 0 96.2 16.1 3.9 12.1 4.8 -494.7 4.9 10.121 9.609 9.271 · · · · · · · · · · · · · · · a LP 685-036 249.0235283 -4.6706628 14.00 2.09 20 0 92.7 21.0 1.7 -403.4 7.0 -46.0 7.0 11.053 10.508 10.183 17.772 15.986 16.827 15.395 13.474 Wolf 990 331.6950150 3.4165094 11.87 2.04 23 0 91.0 17.3 0.9 466.2 6.6 -328.1 6.4 9.409 8.756 8.512 15.395 13.774 14.507 13.170 11.554 LSPM J1212+1125 183.2130856 11.4322653 14.57 2.86 33 0 90.5 16.0 1.1 -360.0 7.3 35.3 5.5 11.553 10.982 10.658 · · · · · · · · · · · · · · · SCR0640-0552 100.0586736 -5.8754097 10.10 1.13 27 2 90.6 13.0 1.2 120.0 30.6 -608.3 30.3 6.835 6.207 5.962 · · · · · · · · · · · · · · · G 75-35 40.3144244 -4.5385069 11.89 2.12 32 0 90.1 9.5 1.1 360.8 15.5 -62.0 13.7 9.199 8.581 8.246 15.556 13.793 14.569 13.162 11.425 G 34-23 20.5440672 22.1501661 11.11 2.22 61 0 87.6 8.5 1.0 236.4 5.7 -157.9 5.7 8.412 7.820 7.537 14.722 12.996 13.763 12.360 10.684 LHS 2629 191.5379703 7.1051369 15.25 2.75 20 0 87.4 22.8 1.1 -320.2 12.9 -463.6 9.2 · · · · · · · · · · · · · · · · · · · · · · · · G 137-84 242.3164317 9.3529094 10.38 2.15 72 0 86.4 8.8 0.9 -345.6 6.2 214.4 6.2 7.969 7.346 7.136 13.122 11.729 · · · · · · · · · G 77-29 47.9034394 -4.2783997 11.78 2.15 52 0 86.3 8.3 1.1 155.8 7.3 -388.8 7.2 9.327 8.722 8.459 15.096 13.414 14.219 12.794 11.357 SCR 1157-0149 179.4413972 -1.8181381 13.92 2.87 24 0 85.0 25.6 1.1 381.9 18.4 -198.9 10.0 10.905 10.354 10.024 17.735 15.938 16.796 15.327 13.416 LHS 2212 149.1104178 22.6492597 12.33 2.25 95 1 83.4 6.8 0.8 -471.8 4.0 -265.2 3.9 9.621 9.030 8.724 15.920 14.196 14.971 13.563 12.932 G 86-28 77.6634100 29.7802881 10.89 2.24 61 0 82.8 5.5 1.5 -248.2 5.0 65.5 4.8 8.600 8.026 7.770 14.100 12.447 13.218 11.851 10.587 G 205-28 277.9927664 40.6879906 10.76 2.11 62 0 81.3 7.3 0.9 -91.5 5.1 422.3 5.2 8.065 7.436 7.184 13.337 11.522 · · · · · · · · · LHS 1354 33.1194844 -8.0714383 10.76 1.13 31 0 80.4 15.7 1.1 -618.6 23.5 -462.0 22.8 8.646 8.073 7.825 13.177 11.983 12.605 11.453 10.430 2MASS J16191111+0140411 244.7957122 1.6780614 12.60 2.96 58 2 80.2 8.8 0.9 -149.6 5.2 -14.7 4.9 9.883 9.347 9.041 16.092 14.420 15.139 13.767 12.158 G 165-58 213.9849417 36.2784358 11.47 3.05 107 1 80.1 4.4 1.2 6.4 2.8 298.1 2.7 8.940 8.366 8.098 14.578 12.833 13.662 12.239 10.891 LTT08905 332.9887339 -7.7153178 11.47 1.99 18 0 78.6 23.0 1.0 418.9 13.1 121.2 11.5 9.243 8.584 8.356 14.201 12.684 13.461 12.094 11.026 TYC 4823-2265-1 108.2966783 -5.1980272 10.33 2.24 37 0 78.7 10.3 1.3 3.6 10.8 -283.7 10.4 7.649 7.077 6.819 12.730 11.183 11.955 10.533 9.496 LP 703-42 355.4148347 -6.5977719 13.18 1.98 27 0 78.1 14.8 1.1 286.7 8.8 -83.1 7.0 10.323 9.701 9.396 16.824 15.170 15.862 14.531 12.714 LHS 6276 225.3342492 5.5470142 10.68 3.09 72 0 77.8 7.6 1.0 81.2 4.6 -442.2 4.4 8.326 7.716 7.432 13.820 12.265 12.966 11.642 10.261 LP 716-010 73.0152011 -10.9735753 13.88 0.96 17 0 77.6 13.2 0.9 -454.0 43.9 -176.0 42.3 10.502 9.965 9.606 · · · · · · · · · · · · · · · 2MASS J15554234-1020015 238.9268294 -10.3339911 11.95 2.10 29 0 77.7 13.4 1.2 79.7 7.6 -66.5 7.5 9.395 8.773 8.523 15.280 13.614 14.343 12.998 11.533 LP 687-17 259.0867467 -5.3980792 11.28 2.12 42 1 80.1 15.6 3.8 169.3 8.7 -124.5 8.7 8.697 8.085 7.829 14.033 12.514 13.236 11.870 10.612 LHS 2935 218.0336583 8.1920331 13.41 2.15 71 0 77.3 6.7 1.0 -475.0 4.6 13.4 4.5 10.108 9.529 9.166 17.678 15.689 16.479 15.075 12.885 G 246-52 58.2938461 62.5679061 10.02 2.27 89 1 78.1 5.8 1.9 34.3 5.0 -270.8 4.8 7.782 7.278 6.997 13.065 11.496 12.261 10.857 9.657 LHS 1631 62.0561447 74.3813919 11.65 2.39 118 3 76.9 5.6 0.8 678.0 4.7 -600.7 4.9 · · · · · · · · · · · · · · · · · · · · · · · · LTT 18035 121.7008094 36.7590119 11.40 2.36 103 1 77.1 5.0 1.1 -153.7 4.1 -384.6 3.8 8.976 8.433 8.128 14.517 12.890 13.656 12.284 10.933 LP 709-018 30.4338767 -10.2904931 12.69 1.14 20 0 77.1 12.7 1.1 287.0 20.1 247.8 20.0 10.030 9.466 9.189 16.234 14.477 15.284 13.857 12.306 LP 746-041 255.1748739 -9.4274778 13.60 2.06 18 0 78.1 22.0 2.5 -240.8 12.5 -201.6 12.2 10.793 10.202 9.871 · · · · · · · · · · · · · · · 2MASS J17155010+1900000 258.9581997 19.0000903 9.16 2.10 42 0 76.2 16.2 0.9 -138.8 8.1 10.8 7.9 7.212 6.635 6.450 11.858 10.370 11.129 9.811 8.841 G 215-30 329.8419692 41.8573222 11.26 2.14 55 0 76.2 8.3 1.1 112.6 5.0 -416.1 5.0 8.982 8.384 8.156 14.307 12.687 13.525 12.127 10.881 LEP1809-0247 272.4564847 -2.7985453 14.31 2.99 17 0 78.2 22.3 3.9 -568.2 6.3 -827.4 6.0 11.426 10.924 10.675 · · · · · · · · · · · · · · · a LTT 08900 332.8079006 -2.5439708 10.74 2.05 23 0 75.2 17.7 1.2 426.7 8.9 -87.0 8.3 8.688 8.138 7.818 13.663 12.151 12.905 11.376 10.509 PM I00580+3919 14.5043108 39.3198539 12.28 2.31 96 0 75.1 4.1 1.1 -107.1 3.2 26.0 3.1 9.561 8.947 8.680 15.837 14.168 14.920 13.535 11.832 PM I22114+4059 332.8501817 40.9999292 12.97 2.11 74 0 72.6 5.9 0.9 -82.4 3.7 62.1 3.7 9.725 9.097 8.790 16.963 15.139 15.904 14.552 12.552 SCR 1921-0223 290.4348411 -2.3884036 13.90 1.27 18 0 73.5 17.8 2.2 14.5 19.5 -183.2 11.8 11.281 10.747 10.503 17.302 15.632 16.306 15.067 13.487 LP 191-43 2.2319339 49.3164483 14.12 2.20 65 0 72.3 5.7 1.0 360.8 4.6 199.1 4.6 10.864 10.320 9.980 · · · · · · · · · · · · · · · 2MASS J22250174+3540079 336.2569867 35.6682072 10.71 2.14 48 0 72.0 10.1 0.9 -61.0 5.2 -147.1 5.2 8.537 7.945 7.741 13.631 12.104 12.886 11.494 10.384 LTT 05282 204.7213064 -2.2632983 10.81 3.06 59 0 72.0 12.3 0.9 -307.8 8.0 -75.2 7.7 8.595 8.008 7.747 13.729 12.133 12.900 11.503 10.397 2MASS J09305084+0227202 142.7117253 2.4559444 12.03 1.21 51 1 71.3 7.2 1.1 -45.3 8.7 82.3 8.6 9.415 8.856 8.578 15.447 13.815 14.554 13.201 11.564 PM I07472+5020 116.8076508 50.3443400 11.39 2.39 111 1 71.2 4.4 0.9 -19.7 3.8 76.7 3.7 8.855 8.299 8.040 14.754 13.092 13.875 12.469 10.996 2MASS J20232212+0800149 305.8421983 8.0032906 13.20 2.59 37 0 71.0 6.0 1.0 31.5 6.6 -208.4 6.0 10.318 9.696 9.407 16.809 15.277 16.016 14.616 12.823 LSPM J1943+4518 295.7810672 45.3036236 14.70 2.27 52 0 70.8 5.7 1.2 115.9 5.0 263.5 5.0 · · · · · · · · · · · · · · · · · · · · · · · · TYC 777-141-1 113.7343122 14.7646436 9.67 1.13 42 0 70.6 7.7 1.0 -79.6 10.7 -103.9 10.0 7.287 6.679 6.398 12.689 11.152 11.929 10.575 9.255 LP 336-4 287.1235358 32.2799292 9.89 3.05 59 0 70.5 5.5 1.2 -196.1 4.3 -227.8 4.3 7.905 7.346 7.074 · · · · · · · · · · · · · · · G 174-25 44.5275825 50.2382425 11.66 2.34 105 2 70.9 4.4 1.7 11.9 3.3 314.4 3.2 9.581 9.008 8.777 14.745 12.987 13.854 12.361 11.304 G 215-54 338.2089694 48.1786428 11.86 2.15 99 2 70.0 7.2 1.1 304.3 4.4 -42.6 4.7 9.505 8.926 8.696 · · · · · · · · · · · · · · · PM I14551+3006 223.7980175 30.1123131 12.16 3.05 159 3 70.1 3.5 1.2 54.3 2.6 -73.6 2.4 9.617 9.036 8.769 15.767 13.778 14.727 13.237 11.727 GSC 03135-00052 293.8709642 37.7685014 9.95 3.03 40 0 69.9 9.6 2.1 -146.9 6.5 -95.0 6.5 7.562 6.948 6.723 13.163 11.626 12.327 10.996 9.600 LP 580-33 338.6921764 4.0442800 11.26 2.05 35 0 68.7 14.0 0.9 -101.4 8.4 134.2 7.8 8.964 8.381 8.129 14.257 13.207 13.445 12.533 · · ·

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

LTT07991 302.7791192 -2.5025378 12.09 1.29 25 0 68.6 12.6 1.2 301.0 17.5 111.4 11.6 9.615 9.006 8.802 15.155 13.617 14.316 13.008 11.872 G 8-31 65.7470208 25.9863128 12.33 2.38 73 0 68.6 6.2 2.1 28.9 4.4 -230.1 3.9 9.645 9.086 8.786 15.784 14.130 14.841 13.501 11.897 GJ 3546 139.5887725 27.3109319 10.53 1.21 20 0 67.6 15.5 1.1 -214.3 17.0 -152.4 16.9 7.022 6.406 6.238 10.831 9.563 10.372 9.188 8.487 LP 702-050 348.9783147 -6.4630267 14.56 1.86 14 0 67.1 24.0 0.9 297.5 17.8 -49.2 14.7 · · · · · · · · · · · · · · · · · · · · · · · · LP629-020 272.8471811 -2.2963697 12.29 3.00 43 1 70.1 15.2 3.9 -66.6 5.0 221.9 4.9 10.232 9.716 9.496 15.045 13.513 14.327 12.893 11.928 a LHS 2024 127.8455903 -10.4995650 13.02 1.22 25 0 67.1 10.0 1.0 -584.0 17.8 -345.2 17.2 10.070 9.489 9.136 16.968 15.039 15.866 14.410 12.551 CCDM J14372+7537B 219.3049042 75.6116272 11.14 3.09 204 3 66.8 4.2 0.8 169.5 2.8 -133.3 2.8 9.078 8.537 8.273 · · · · · · · · · · · · · · · LSPM J0801+2342 120.4310694 23.7070861 9.66 2.06 49 0 66.8 9.2 0.8 -99.2 10.3 -111.4 10.3 7.670 7.017 6.802 12.443 10.882 11.700 10.286 10.455 G 139-17 257.4682514 11.9257611 12.25 3.06 67 0 66.4 9.2 0.9 -349.9 3.8 -102.9 3.8 9.611 8.997 8.729 15.718 14.000 14.800 13.414 11.781 UPM 1623-0641 245.7795181 -6.6978522 13.47 3.03 27 0 67.3 20.5 1.9 -139.0 5.3 -13.9 5.2 11.051 10.424 10.149 16.292 14.965 15.627 14.312 13.126 RX J1831.3+6454 277.8407353 64.9039589 11.77 3.07 136 0 65.9 4.4 0.8 -7.2 2.7 67.4 2.8 9.360 8.796 8.533 15.116 13.421 14.254 12.823 11.320 LHS 2691 197.8382447 28.5431356 13.80 2.91 77 0 66.2 6.1 1.1 -407.9 4.5 -445.0 4.2 10.841 10.270 9.966 · · · · · · · · · · · · · · · UPM 0151+4652 27.9148636 46.8779806 13.06 2.34 137 1 66.1 3.8 1.1 41.7 3.4 10.7 3.4 10.165 9.581 9.268 16.977 15.053 15.918 14.446 12.580 LP 691-015 282.2776561 -3.2550136 12.35 2.10 48 0 68.8 7.6 3.9 261.1 7.3 -10.6 7.0 9.613 8.981 8.702 15.907 14.237 14.941 13.578 11.869 a LP 698-002 323.1246575 -5.2010881 14.85 1.96 12 0 65.4 14.9 0.9 114.7 11.5 -340.0 11.0 · · · · · · · · · · · · · · · · · · · · · · · · PM I13413-0907 205.3388453 -9.1212242 11.77 2.08 43 0 65.6 9.8 1.1 102.3 5.8 53.5 5.7 9.444 8.906 8.668 14.912 13.322 14.088 12.717 11.365 G 259-20 265.7829972 85.4405850 10.84 3.04 163 2 65.4 7.4 1.0 -104.6 4.3 -262.3 4.3 8.736 8.067 7.889 13.555 11.917 12.751 11.351 10.325 LHS 3854 341.9778433 31.8718164 11.36 2.17 60 2 65.6 10.9 1.3 457.5 4.5 183.8 4.8 9.087 8.522 8.244 14.450 12.913 13.655 12.294 10.991 SCR 1756-0206 269.1805222 -2.1070925 13.58 2.13 22 0 67.0 23.2 3.1 -66.5 6.6 -192.0 4.7 11.295 10.664 10.459 16.639 15.177 15.876 14.586 13.241 CCDM J14372+7537A 219.2911406 75.6153664 10.64 3.09 194 2 64.4 4.5 0.8 164.7 3.0 -145.6 2.9 8.650 8.092 7.859 13.993 12.422 13.145 11.974 10.627 G 244-37 27.9652408 64.4342592 10.00 2.32 68 1 64.4 6.6 1.0 248.2 6.7 -198.1 6.7 7.838 7.250 6.937 13.089 11.379 12.099 10.803 9.685 2MASS J11473762+0501106 176.9069686 5.0196944 10.73 2.94 62 0 64.3 9.8 1.1 56.1 6.6 33.3 5.9 8.223 7.644 7.381 13.927 12.383 13.090 11.769 10.361 G 251-19 105.8750825 76.7727108 11.15 2.40 149 1 64.3 4.4 1.1 11.7 4.3 -234.0 4.1 8.836 8.221 7.961 14.293 12.683 13.491 12.107 10.752 LP 692-14 289.9800883 -4.7752061 10.76 1.96 23 0 65.4 12.9 2.5 119.7 14.1 -72.2 12.8 8.312 7.660 7.477 13.715 12.279 12.920 11.671 10.265 LSPM J1831+0650 277.8174472 6.8356703 9.53 2.09 33 0 64.8 10.9 2.0 155.6 11.0 -123.9 9.4 7.579 6.973 6.744 12.845 10.995 · · · · · · · · · G 103-41 98.6394819 31.5015061 11.00 2.31 78 1 63.8 5.1 1.1 37.3 4.5 -189.1 4.4 8.705 8.152 7.898 14.089 12.564 13.193 12.018 10.642 SCR 2151-0612 327.7503228 -6.2154419 13.09 1.92 24 0 63.6 14.1 1.0 -4.3 10.3 -157.7 8.4 10.618 10.009 9.750 16.146 14.762 15.415 14.179 12.801 LP 60-205 137.1937558 66.5934725 11.41 2.41 139 1 63.6 4.4 1.0 205.7 3.9 -139.5 3.8 9.168 8.674 8.409 14.667 12.935 13.802 12.282 11.040 G 120-40 170.4796322 26.8302650 12.56 2.88 89 0 63.4 5.6 1.2 -298.4 3.9 -119.8 3.8 9.931 9.367 9.122 15.937 14.299 15.107 13.724 12.153 LP 496-48 193.7105736 11.9857942 13.63 2.97 81 0 63.1 9.8 1.1 -274.2 5.5 -397.9 4.7 10.509 9.997 9.621 17.549 15.783 16.497 15.174 13.121 L797-023 20.8250328 -12.9385053 11.45 0.91 12 0 62.5 20.0 1.1 -3.0 34.5 349.2 31.3 9.181 8.628 8.350 14.661 13.009 13.831 12.377 11.178 SCR 0211-0354 32.9653058 -3.9014139 13.73 1.98 12 0 62.4 21.2 1.1 -35.3 25.7 -141.9 25.2 10.680 10.069 9.732 17.518 15.791 16.715 15.183 13.279 LSPM J0012+0206 3.0122514 2.1068697 13.35 1.83 26 0 62.0 14.1 0.9 299.5 11.8 80.2 10.4 10.590 10.013 9.721 16.954 15.163 15.961 14.539 12.873 LP 518-40 325.8778750 12.8196539 12.01 2.08 37 0 61.7 12.6 0.9 -28.9 5.7 -306.4 5.6 9.608 9.025 8.780 14.984 13.480 14.138 12.887 11.784 LSPM J2138+5257 324.5721506 52.9553400 15.65 2.34 39 0 62.0 9.0 1.3 225.7 7.0 30.3 6.5 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J0656+2211 104.0362386 22.1932575 15.41 2.21 19 0 61.6 8.6 1.1 -159.7 6.9 -164.0 6.8 · · · · · · · · · · · · · · · · · · · · · · · · GJ 3480 122.0744925 58.5190378 11.14 2.39 119 1 61.5 4.9 1.1 -180.9 4.1 -61.9 3.9 8.804 8.238 7.962 14.395 12.784 13.478 12.120 10.833 LSPM J1229+0752 187.4370539 7.8773906 15.68 2.74 18 0 61.4 19.9 1.1 -437.5 10.5 61.8 7.7 · · · · · · · · · · · · · · · · · · · · · · · · LTT 15193 262.1267803 37.4512303 11.73 3.05 121 5 61.1 4.4 1.1 18.0 2.5 -186.5 2.6 9.387 8.789 8.536 14.940 13.243 14.020 12.639 11.291 G 96-4 72.5648117 45.9796317 10.49 2.27 101 0 61.7 4.2 1.8 201.4 3.7 -237.3 3.7 8.533 · · · 7.704 13.280 11.769 12.539 11.184 10.265 LSPM J0830+5552 127.5441394 55.8809133 13.42 2.40 106 1 60.7 4.1 0.9 194.1 3.7 61.5 3.4 10.650 10.054 9.772 17.127 15.382 16.026 14.694 12.938 LSPM J1558+3524 239.5775486 35.4081592 11.13 3.04 102 2 60.5 5.0 0.9 -146.3 4.0 319.4 3.6 8.694 8.100 7.869 14.333 12.675 13.466 12.100 11.872 SCR 1645-0843 251.2598464 -8.7286811 14.50 2.08 15 0 61.3 17.8 1.9 -103.2 7.1 -349.0 7.1 11.953 11.420 11.139 · · · · · · · · · · · · · · · LP 630-11 276.0222322 1.6868589 10.51 3.03 54 1 63.7 11.8 4.4 155.9 7.5 -237.1 7.0 8.297 7.737 7.487 13.397 11.863 12.597 11.255 10.217 LSPM J1121+2126 170.2844833 21.4409247 14.96 2.04 24 0 60.4 14.8 1.1 -242.2 8.3 -2.2 8.2 · · · · · · · · · · · · · · · · · · · · · · · · PM I22489+1819 342.2273519 18.3325547 12.69 2.18 63 0 60.1 8.3 1.0 -27.2 4.2 -134.9 4.2 9.957 9.388 9.119 16.115 14.535 15.251 13.937 12.337 Wolf 755 262.9083617 1.7966997 10.72 3.04 55 0 60.4 12.7 1.4 -167.0 6.7 -95.5 6.7 8.586 8.001 7.771 13.579 12.075 12.819 11.448 10.588 LP 699-32 331.5407997 -7.3941036 13.97 1.99 16 0 59.8 16.3 1.0 190.4 18.4 -213.4 17.3 10.674 10.062 9.759 18.074 16.272 17.070 15.500 13.673 LHS1325 30.1956792 -10.3571350 12.44 1.14 28 0 59.3 16.2 1.1 -383.9 24.5 -322.3 24.4 9.890 9.346 9.092 15.748 14.113 14.881 13.487 12.075 PM I18044-0111 271.1197108 -1.1908378 10.95 3.00 51 0 61.1 17.1 3.0 -24.2 6.5 -48.6 6.5 8.833 8.264 7.989 13.772 12.310 13.022 11.657 10.644 G 210-20 307.0937889 34.2022592 12.92 2.92 69 0 59.3 4.1 1.5 354.8 3.8 -53.4 3.8 10.189 9.639 9.346 16.600 14.866 15.639 14.155 12.484 LSPM J0101+2915 15.2796397 29.2589456 12.64 2.30 68 0 58.7 6.4 0.9 204.9 5.0 -46.8 5.0 10.181 9.622 9.358 16.109 14.338 15.169 13.698 12.241 G 85-12 71.1090367 27.8605022 10.45 1.38 40 1 60.0 7.0 2.3 92.0 8.9 -449.4 8.9 7.908 7.298 7.106 12.689 11.187 11.920 10.570 9.585 G 69-24 12.1890939 27.0181050 10.97 2.16 53 1 58.8 9.2 1.1 -169.2 6.9 -278.8 6.9 8.774 8.190 7.979 13.674 12.267 · · · · · · · · · UPM 0900+7522 135.0542436 75.3724578 12.93 2.39 126 2 58.7 3.7 1.1 46.0 3.8 -109.0 3.7 10.243 9.669 9.401 16.548 14.815 15.584 14.176 12.459 Wolf 1495 207.2547911 2.7900886 9.82 3.02 63 1 58.5 10.2 1.1 144.9 6.4 -308.5 6.0 7.839 7.237 6.935 12.733 11.200 11.937 10.569 9.512 Wolf1467 280.2089331 -8.0839197 12.18 2.11 39 0 60.8 10.4 3.5 -136.1 8.4 -246.2 8.5 9.562 9.051 8.736 15.496 13.862 14.524 13.256 11.660 LSPM J1432+1600W 218.0457944 16.0133975 11.89 3.03 139 2 58.4 4.2 1.1 178.0 3.2 -64.2 3.0 9.288 8.715 8.471 15.249 13.633 14.304 13.050 11.497 G 125-69 303.2269544 34.2771544 10.12 2.92 51 1 58.8 6.5 1.6 -371.8 5.5 -122.5 5.7 8.213 7.619 7.451 12.644 11.125 · · · · · · · · · TYC 4530-1414-1 107.9879661 77.3660017 9.71 2.38 101 1 58.2 6.9 1.1 12.3 6.6 -108.4 6.3 7.723 7.139 6.915 12.458 10.962 11.735 10.372 9.417 Ross 912 175.9389953 2.0111817 12.13 2.94 76 3 58.2 8.3 1.2 489.8 5.8 -201.4 4.9 9.772 9.189 8.954 15.193 13.657 14.393 13.075 11.789 LHS 6394 331.5033364 39.2986617 11.25 2.14 66 1 57.8 7.8 0.9 71.2 4.8 -461.2 4.8 8.912 8.308 8.071 14.297 12.710 13.506 12.102 10.841 LP 284-7 309.1926669 38.8418389 11.71 2.71 69 2 58.4 5.2 1.5 174.3 4.6 -146.6 4.5 9.270 8.707 8.461 · · · · · · · · · · · · · · · LHS 2952 219.2253694 58.3458953 10.53 3.08 140 1 57.7 4.2 1.0 620.4 3.2 -707.5 3.1 · · · · · · · · · 13.379 11.769 12.576 11.199 10.031

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

LHS 3689 323.4541833 -6.8547497 12.26 1.96 28 0 57.6 10.9 1.0 130.4 9.2 -493.9 8.8 9.562 8.937 8.655 · · · · · · · · · · · · · · · 2MASS J01434512-0602400 25.9383014 -6.0446339 11.26 1.99 22 0 57.7 20.7 1.1 52.8 18.3 -1.0 18.3 8.770 8.174 7.912 14.631 12.949 13.754 12.344 10.933 SCR1927-0409 291.8044450 -4.1646194 13.51 1.27 25 0 59.3 18.9 2.8 80.6 19.6 -270.3 11.4 10.558 9.940 9.676 · · · · · · · · · · · · · · · HD 63991 118.1977819 25.9259111 11.13 1.23 45 0 57.5 8.5 1.1 43.6 12.3 -156.5 12.3 6.663 6.150 6.050 9.626 8.821 9.769 8.693 7.964 G 88-2 104.8694594 19.5085031 11.26 2.29 54 0 57.5 6.0 1.0 -173.9 4.8 -213.1 4.8 8.939 8.353 8.122 14.382 12.815 13.532 12.235 10.901 LHS 1352 33.0013883 32.3620511 13.78 2.34 68 0 57.4 5.4 1.0 534.1 4.4 -223.3 4.3 · · · · · · · · · 17.044 15.737 16.316 15.172 13.313 LHS 2262 156.5086625 50.4502622 11.82 2.32 169 1 57.5 3.7 1.1 -367.4 4.3 -552.2 4.4 9.268 8.670 8.403 · · · · · · · · · · · · · · · LHS 2052 132.2841283 39.6060578 13.69 2.36 85 0 57.4 4.3 1.0 -387.4 4.0 -334.6 3.9 10.584 10.021 9.640 · · · · · · · · · · · · · · · LSPM J0903+0540 135.8371300 5.6692400 14.30 2.18 18 0 57.2 17.3 1.0 -72.0 12.3 -374.8 11.5 · · · · · · · · · · · · · · · · · · · · · · · · GJ 4110 291.7058367 16.7163511 11.60 3.00 47 0 58.3 6.7 2.3 36.5 6.1 -206.5 6.0 9.000 8.361 8.157 14.573 13.035 · · · · · · 11.072 G 94-16 27.2586044 25.2052481 13.58 2.29 62 0 57.0 6.6 1.1 402.1 4.4 59.3 4.3 10.672 10.074 9.773 · · · · · · · · · · · · · · · SCR 1247-0525 191.8097092 -5.4181444 12.89 2.07 25 0 57.1 11.3 1.1 -490.9 7.1 566.0 6.7 10.126 9.620 9.291 16.497 14.784 15.536 14.143 12.373 LSPM J0154+5741S 28.6166931 57.6911081 10.99 2.32 92 0 57.2 4.1 1.3 -28.6 3.6 -196.7 3.7 8.525 8.005 7.736 13.670 12.363 12.970 11.826 10.491 G 138-33 247.0085369 15.5645297 11.71 3.06 90 0 57.0 6.7 1.1 -19.9 3.8 -299.1 3.6 9.375 8.802 8.556 14.871 13.258 14.017 12.613 11.322 LHS 2662 195.0298714 30.6502683 15.32 2.86 30 0 57.0 11.8 1.1 -330.0 7.5 383.5 7.3 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J1203+7907 180.8919636 79.1171169 15.71 2.89 37 0 56.8 8.3 1.0 -411.4 7.6 79.6 6.6 · · · · · · · · · · · · · · · · · · · · · · · · SCR 2310-0944 347.5843486 -9.7490156 14.35 1.80 15 0 56.7 18.1 1.0 3.1 22.8 -154.3 22.1 12.073 11.495 11.243 · · · · · · · · · · · · · · · 2MASS J09351319+6114370 143.8058667 61.2437464 10.53 2.39 101 2 56.6 5.0 0.9 119.5 5.4 25.6 5.6 8.463 7.851 7.623 13.485 11.909 12.735 11.265 10.228 LP 247-47 53.6382122 37.6677606 15.77 2.19 23 0 57.0 12.6 1.4 -169.6 8.7 153.0 8.6 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J0212+1032 33.1928950 10.5480125 14.92 2.03 20 0 56.6 16.9 1.1 -77.8 6.4 -133.5 5.9 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J21162729+0234514 319.1146200 2.5807414 10.57 1.97 17 0 56.7 12.7 1.2 260.0 12.9 -39.8 12.3 8.219 7.601 7.324 13.441 11.967 12.656 11.377 10.275 LP 1-52 37.3093975 88.4053961 11.38 1.39 31 1 56.7 16.7 1.3 -133.2 18.4 409.7 14.1 · · · · · · · · · 14.389 12.870 13.536 12.251 10.984 G 220-6 34.2710067 54.5827942 13.10 2.32 128 0 56.5 3.4 1.1 -64.4 2.9 306.7 2.9 10.482 10.043 9.781 16.647 14.916 15.676 14.293 12.699 G 143-47 305.6309372 9.3653192 11.73 1.97 33 0 56.3 9.1 0.9 205.0 10.9 46.3 8.9 9.555 8.951 8.756 14.719 13.238 13.966 12.651 11.351 PM I05511+1216 87.7937533 12.2692778 12.02 2.21 62 0 56.4 6.1 1.2 75.0 5.2 -51.5 5.1 9.453 8.885 8.584 15.348 13.720 14.493 13.155 11.661 LTT 14694 237.5474097 0.9589119 10.95 3.02 73 0 56.1 8.4 0.9 187.9 4.4 -40.0 4.2 8.677 8.086 7.831 14.036 12.460 13.223 11.866 10.595 UPM 0515+2336 78.8232567 23.6070100 13.19 2.19 52 0 57.2 6.9 2.1 36.7 7.1 -75.5 6.8 10.186 9.602 9.306 16.977 15.245 15.954 14.591 12.726 NLTT 22280 144.8740761 14.6468097 11.80 2.31 69 1 56.2 8.5 1.1 -156.7 5.1 -74.3 5.1 9.393 8.823 8.554 15.015 13.432 14.154 12.799 11.449 2MASS J04510138+3127238 72.7568931 31.4564294 11.40 2.21 64 2 57.6 4.6 2.6 233.6 4.3 -45.6 4.3 9.011 8.432 8.163 14.559 12.945 13.727 12.358 11.012 2MASS J15574826+0901099 239.4517664 9.0187886 11.86 3.03 84 3 55.9 6.2 0.8 139.8 3.1 -151.5 3.0 9.282 8.691 8.434 15.213 13.554 14.358 13.023 11.348 LP 489-20 151.1091536 9.4321939 12.41 2.94 58 0 56.1 8.9 1.1 -223.9 7.5 97.8 7.4 9.996 9.448 9.155 15.514 13.886 14.705 13.291 11.973 G 16-5 233.5005567 4.6136294 11.91 3.02 69 0 55.8 8.5 1.0 -142.6 4.0 -210.4 3.6 9.573 9.065 8.767 14.879 13.302 14.056 12.724 11.513 G 121-28 178.2399122 24.4795936 12.63 2.88 80 0 56.0 7.1 1.1 -311.2 3.5 84.5 3.1 9.937 9.308 9.016 · · · · · · · · · · · · · · · G 108-52 106.3015936 8.4295708 10.90 2.28 39 0 56.0 6.5 1.2 87.0 6.2 -410.7 5.8 8.829 8.292 7.984 13.822 12.241 13.006 11.622 10.628 LHS 2909 215.9337511 14.4455319 14.82 2.83 42 0 55.8 9.5 1.1 329.7 7.1 -538.1 6.6 · · · · · · · · · · · · · · · · · · · · · · · · UPM 1943-0035 295.9121381 -0.5898519 14.79 1.27 16 0 56.1 20.3 1.5 -245.8 23.9 42.8 15.0 12.195 11.669 11.372 · · · · · · · · · · · · · · · G 46-21 136.9140442 6.2999700 11.16 1.31 45 0 55.5 9.4 1.0 -366.7 10.6 -67.1 10.5 9.150 8.483 8.284 13.866 12.470 13.136 11.892 10.892 LHS 2263 156.5114092 50.4538633 12.00 2.32 177 1 55.5 3.5 1.1 -373.8 3.9 -553.3 4.0 9.404 8.791 8.547 · · · · · · · · · · · · · · · G 31-42 4.7683069 4.3472425 12.59 1.90 38 0 55.0 11.0 0.7 -395.7 7.8 -219.6 6.1 10.134 9.550 9.274 15.905 14.194 15.006 13.552 12.398 SCR 2356-0429 359.0858344 -4.4921831 12.03 1.92 29 0 55.0 11.8 0.8 194.4 8.3 -24.6 7.1 9.642 9.041 8.777 · · · · · · · · · · · · · · · G 182-4 260.9533725 31.7157039 13.52 3.04 76 3 55.3 5.5 1.1 27.3 3.4 361.7 3.3 10.909 10.333 10.038 16.936 15.340 16.111 14.744 13.060 2MASS J05194942-0436165 79.9553275 -4.6047356 12.14 1.41 43 0 55.3 6.3 1.2 -142.9 12.8 -1.1 12.8 9.681 9.124 8.849 15.402 13.803 14.554 13.213 11.776 G 105-37 96.9327997 9.3978439 10.42 2.28 34 1 55.1 9.7 1.1 -172.9 9.0 -197.5 8.8 8.269 7.727 7.438 13.320 11.774 12.545 11.136 10.118 G 35-32 32.9216200 18.5616983 10.99 2.16 51 0 55.0 8.2 1.0 191.5 4.4 268.8 4.4 8.672 8.134 7.866 14.017 12.520 13.236 11.944 10.632 LSPM J1840+7557 280.2445450 75.9671372 14.95 3.07 91 0 54.9 6.1 0.9 -19.4 3.6 177.9 3.6 11.660 11.066 10.729 · · · · · · · · · · · · · · · PM I17225+0531 260.6409222 5.5208831 11.13 3.02 51 0 54.8 12.4 0.8 -101.4 6.2 -9.5 6.2 8.966 8.310 8.120 14.181 12.568 13.355 11.966 10.885 LHS 2896 214.9273328 7.9732375 13.91 2.14 52 0 55.0 8.2 1.1 -546.9 6.3 -146.3 6.0 10.938 10.381 10.034 17.730 15.920 16.715 15.236 13.441 LHS 6422 350.4851378 24.2080700 12.18 2.19 63 0 54.5 5.9 0.6 409.7 3.1 -189.5 3.1 9.779 9.172 8.940 15.421 13.813 14.553 13.211 12.645 SCR 1901-0737 285.3844567 -7.6238339 13.68 1.95 24 1 56.1 12.9 2.2 -129.8 12.9 -97.3 11.1 10.567 10.002 9.699 · · · · · · · · · · · · · · · G 142-10 287.4240228 9.8148408 12.89 3.03 36 0 56.7 8.9 3.0 129.6 7.0 -351.6 6.1 10.362 9.755 9.455 16.094 14.429 15.231 13.864 12.424 LSPM J1730+8444 262.5122950 84.7372686 14.16 3.02 156 0 54.6 6.4 0.9 86.8 4.0 -133.3 4.1 11.121 10.530 10.233 18.076 16.063 · · · · · · 13.267 G 56-11 165.7834744 15.2973989 11.39 2.05 76 1 54.9 8.0 1.2 -412.0 5.6 -97.6 5.2 8.890 8.301 8.028 14.712 13.074 13.898 12.480 11.004 G 259-5 254.3735753 77.7183619 11.04 3.08 159 1 54.4 6.0 0.8 202.5 3.0 162.0 3.1 8.982 8.385 8.164 14.134 12.523 13.452 12.124 11.087 G 168-13 237.3348458 25.0632233 10.95 3.04 108 0 54.6 4.8 1.0 -33.1 3.2 392.8 3.1 8.884 8.314 8.063 13.830 12.314 13.058 11.715 · · · G 247-39 73.4196472 62.3167936 11.62 2.37 111 2 54.9 3.9 1.4 273.1 3.2 -236.9 3.2 9.226 8.673 8.418 14.936 13.343 14.051 12.721 11.312 LHS 1663 65.4983617 75.1392272 10.71 2.38 112 3 54.5 5.2 0.9 539.7 4.9 -480.5 4.8 · · · · · · · · · 13.530 12.052 12.828 11.530 10.338 LSPM J0225+6229 36.3616428 62.4985872 15.94 2.28 24 0 55.1 13.5 1.6 249.5 10.4 -229.3 10.2 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J1904+2401 286.1301208 24.0319583 8.25 3.04 66 1 54.8 6.4 1.3 -139.5 4.1 14.9 4.0 8.789 8.167 7.915 13.946 12.570 · · · · · · · · · b LHS 2461 177.1924189 53.0851414 12.72 3.01 139 1 54.5 3.1 1.1 -582.9 2.7 -178.3 2.6 10.131 9.556 9.283 16.352 14.580 15.363 13.939 12.404 LHS 2480 179.3728383 79.4500500 15.14 3.07 68 1 54.4 6.0 1.0 -875.3 5.6 -153.8 5.1 · · · · · · · · · · · · · · · · · · · · · · · · LP 391-10 282.9186717 24.4587692 8.85 3.05 66 0 54.6 5.1 1.3 -358.4 3.6 -40.5 3.6 · · · · · · · · · 13.685 13.047 · · · · · · · · · b LSPM J1728+7108 262.0454139 71.1409567 12.05 3.09 174 2 53.9 4.2 0.7 -193.6 2.2 55.4 2.2 9.820 9.271 9.019 15.551 13.645 14.707 13.089 11.795 PM I07105-0842 107.6307256 -8.7130036 11.51 0.83 26 0 54.3 20.9 1.1 -94.5 38.5 36.7 15.3 9.054 8.459 8.164 14.780 13.203 13.912 12.585 11.133 G 230-41 307.0774789 61.7299169 11.60 2.94 72 1 54.5 5.5 1.4 -292.9 4.0 -13.8 4.0 · · · · · · · · · · · · · · · · · · · · · · · ·

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

PM I18467+0043 281.6952164 0.7237961 12.17 3.01 55 0 56.9 6.7 3.8 107.7 4.6 -28.2 4.0 9.593 9.002 8.733 15.560 13.906 14.660 13.288 11.643 LSPM J0213+1803 33.2536706 18.0618053 13.14 2.15 51 0 54.0 9.8 1.0 128.2 4.3 -202.5 4.1 10.306 9.796 9.520 16.661 15.000 15.744 14.373 12.774 LSPM J1423+5146 215.7628072 51.7758975 15.79 2.91 36 0 54.1 12.6 1.1 358.2 7.4 202.0 7.0 9.322 8.745 8.528 14.651 13.190 13.794 12.460 11.134 2MASS J08185804+2333522 124.7405831 23.5631100 16.11 2.34 21 0 54.1 9.3 1.1 -257.5 9.0 -336.1 8.2 · · · · · · · · · · · · · · · · · · · · · · · · G 264-22 333.8590072 66.2252000 11.20 2.38 100 0 54.9 5.4 2.0 3.8 4.1 203.4 4.0 8.749 8.127 7.886 14.490 12.892 13.586 12.252 10.804 LSPM J1546+3102 236.5961756 31.0494356 14.20 2.85 79 0 54.0 5.6 1.1 -321.9 4.2 249.5 4.0 11.135 10.586 10.264 · · · · · · · · · · · · · · · PM I00427+4349 10.6991136 43.8233614 10.70 2.28 74 1 53.8 6.5 1.0 -23.1 5.2 -53.8 5.1 8.487 7.907 7.632 13.683 12.175 12.935 11.605 10.403 2MASS J12414736+5 190.4481547 56.7538289 11.86 3.08 177 2 53.7 3.0 1.0 125.2 2.3 -3.6 2.4 9.483 8.848 8.608 15.016 13.496 14.165 12.913 11.538 NLTT 45438 266.7922939 -1.4998303 12.03 2.13 43 0 54.8 10.3 2.3 -37.3 3.8 -320.8 3.5 9.616 9.026 8.755 15.312 13.523 14.400 12.941 11.600 LHS 2270 157.1701858 32.2393506 11.41 2.95 115 2 53.5 6.2 1.0 -474.3 4.8 167.5 4.7 9.043 8.601 8.357 14.661 12.989 13.812 12.406 11.044 L 1246-11 103.1018756 18.2852261 11.52 2.29 51 0 53.7 6.9 1.2 127.8 4.6 114.4 4.5 9.052 8.445 8.160 14.702 13.203 13.889 12.602 11.160 L 1246-11 103.1018394 18.2851883 11.52 2.29 51 0 53.7 6.9 1.2 127.8 4.6 114.4 4.5 9.052 8.445 8.160 14.702 13.203 13.889 12.602 11.160 G 122-74 183.0484961 48.8164136 11.40 3.08 121 1 53.6 7.1 1.2 192.5 4.9 -293.6 4.9 9.258 8.513 8.394 14.458 12.914 13.599 12.329 11.063 LHS 6327 269.5935478 12.7607686 12.08 3.03 77 1 53.8 5.8 1.4 333.9 3.6 -294.8 3.7 9.714 9.168 8.922 15.324 13.640 14.388 13.012 11.642 G 222-18 117.3250803 84.9758908 11.31 1.47 123 7 53.4 5.0 1.1 -154.2 6.7 -346.2 6.3 8.988 8.347 8.120 14.368 12.816 13.564 12.246 10.919 G 191-32 80.2936925 55.7628383 11.48 2.38 95 4 54.2 3.7 1.9 131.0 3.5 -287.6 3.4 9.229 8.629 8.374 14.560 13.026 13.708 12.424 11.108 LHS 4022 357.6534314 9.9491678 10.00 2.13 26 0 53.2 19.2 1.1 633.6 12.4 249.7 12.0 7.672 7.098 6.807 12.908 12.559 12.168 11.158 9.913 2MASS J00080642+4757025 2.0260139 47.9506728 11.00 2.25 94 1 53.2 6.0 1.1 -122.4 5.1 11.9 5.1 8.523 8.000 7.677 14.390 12.779 13.472 12.150 10.640 G 122-58 179.5741419 42.5729583 12.27 3.01 138 2 53.3 4.4 1.2 136.1 3.2 -375.0 3.0 9.594 8.978 8.710 15.476 14.012 14.606 13.330 11.779 PM I08202+0532 125.0553617 5.5356167 10.57 2.35 48 0 53.0 6.2 0.9 -75.7 5.3 1.3 5.2 8.526 7.913 7.670 13.366 11.914 12.660 11.349 10.287 G 65-40 214.2691206 10.5929208 10.20 2.14 82 0 53.1 6.6 1.1 -285.3 5.4 -104.6 5.3 8.185 7.533 7.279 12.983 11.551 12.202 10.935 9.924 LSPM J0219+5919 34.9841192 59.3234675 14.93 2.29 56 0 53.7 6.5 1.8 94.2 5.4 -203.4 5.4 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J2240+1736 340.2457156 17.6113772 11.32 2.15 47 0 52.9 10.9 1.0 161.2 5.2 29.5 5.2 9.225 8.669 8.426 14.040 12.579 13.320 12.001 11.038 LP 220-50 212.3818831 41.6358864 13.80 3.06 93 0 52.9 5.4 1.1 -212.5 3.3 69.7 3.1 10.706 10.187 9.848 17.800 15.915 16.763 15.250 13.232 G 225-72 251.4795653 60.9500950 11.78 3.08 176 1 52.8 4.7 1.1 32.4 2.4 -288.1 2.4 9.393 8.840 8.568 14.973 13.411 14.204 12.855 11.382 LHS 2659 194.8599978 56.5625936 11.69 3.08 182 2 52.8 3.2 1.1 -581.5 2.3 -82.3 2.3 · · · · · · · · · 14.636 13.229 13.870 12.630 11.351 LHS 1137 11.0893183 9.1262778 12.22 2.01 55 1 52.7 9.8 1.0 801.8 5.4 -10.4 4.5 9.501 8.957 8.621 15.658 14.080 14.754 13.484 11.800 GSC 03857-00830 205.4426678 58.2555256 11.09 3.08 143 2 52.6 4.9 1.0 72.3 3.4 -60.8 3.4 8.733 8.171 7.876 14.356 12.545 13.391 11.990 10.750 G 253-013 128.0600994 84.4097892 11.81 1.42 139 3 52.7 4.8 1.1 363.4 6.6 257.7 6.0 9.441 8.888 8.623 15.036 13.420 14.202 12.825 11.432 2MASS J21044799-0418264 316.2001503 -4.3073794 12.52 1.95 24 0 52.4 12.6 0.9 50.9 7.8 -24.7 7.8 9.875 9.288 9.052 15.934 14.313 15.002 13.698 12.163 UPM 0458+4526 74.5759372 45.4463964 12.73 2.28 130 1 53.1 3.0 1.7 -6.2 2.7 -116.6 2.6 10.143 9.642 9.383 16.269 14.621 15.326 14.026 12.387 LP 577-44 321.4433078 6.6241872 11.99 1.99 32 0 52.5 14.8 1.1 210.9 5.9 -64.4 5.9 9.625 9.065 8.759 14.971 13.487 14.200 12.901 11.600 LHS 1973 120.6878914 59.0278664 12.08 2.39 147 1 52.5 3.8 1.1 495.8 3.5 -207.6 3.2 · · · · · · · · · 15.273 13.734 14.422 13.128 11.745 UPM 0735-0048 113.9647531 -0.8153150 12.89 2.25 56 0 52.5 6.8 1.1 -96.1 5.2 51.7 4.8 10.199 9.594 9.307 16.375 14.696 15.458 14.075 12.417 LP 34-161 107.3830119 69.8482161 11.02 2.40 116 2 52.3 5.1 0.9 -182.0 4.7 -269.0 4.2 8.862 8.266 8.028 13.930 12.419 13.240 11.878 10.682 Ross 1063 293.4154411 39.5252300 10.29 2.95 47 2 53.0 7.4 1.7 214.2 5.8 -407.9 5.6 8.120 7.560 7.339 13.611 11.600 · · · · · · · · · Wolf 422 188.2299633 12.1923147 11.76 3.03 108 2 52.5 8.1 1.2 -526.2 4.9 -68.4 4.3 9.462 8.842 8.600 14.752 13.227 13.920 12.643 11.414 LSPM J1954+1738 298.5772256 17.6420125 13.15 2.94 46 2 54.0 5.1 2.8 209.8 6.3 146.5 6.0 10.516 9.993 9.719 16.260 14.706 15.366 14.105 12.543 G 205-38 282.6900250 47.9715397 11.10 3.07 82 1 52.2 5.3 1.0 252.6 4.1 -113.7 3.9 8.686 8.128 7.900 13.896 12.521 13.109 11.949 10.674 LP 501-31 223.1186383 12.3915067 10.18 3.03 80 0 51.9 6.2 0.7 -53.8 4.6 -219.5 4.5 7.967 7.340 7.115 13.035 11.571 12.308 10.970 10.123 LSPM J0950+3052 147.5372253 30.8703775 13.69 2.30 62 0 52.3 6.2 1.1 -198.5 5.5 -3.9 5.4 10.708 10.116 9.870 · · · · · · · · · · · · · · · G 188-39 330.6766011 28.2989322 12.22 2.13 57 2 52.1 9.2 1.0 389.4 4.6 -103.4 4.6 9.841 9.291 9.036 15.405 13.795 14.568 13.208 11.828 2MASS J12054715+7825514 181.4422122 78.4310017 10.77 3.07 188 1 52.1 4.1 1.1 -200.1 3.4 9.4 3.4 8.575 7.963 7.736 13.661 12.114 12.927 11.537 10.417 PM I23462+2826 356.5589733 28.4346383 11.38 2.20 55 0 51.9 9.9 0.9 91.6 6.0 67.3 6.0 8.957 8.383 8.115 14.623 12.961 13.744 12.351 10.994 G 189-32 340.5761442 31.2791392 12.29 2.17 64 5 52.4 8.1 1.5 -76.6 3.4 -237.3 3.5 9.847 9.231 9.023 15.428 13.871 14.593 13.235 11.856 PM I14215-0755 215.3915658 -7.9216267 12.00 2.08 51 0 51.9 9.0 1.1 -97.2 5.5 -76.0 5.3 9.456 8.930 8.630 15.190 13.605 14.290 13.023 11.529 GSC 03461-00403 192.1443861 49.5649503 10.99 3.09 130 3 52.0 3.4 1.1 111.8 2.7 -15.1 2.7 8.684 8.019 7.775 14.110 12.512 13.317 11.889 10.650 GJ 3321 75.4612078 3.7648381 10.01 2.18 32 0 51.9 7.8 1.2 142.0 8.2 -139.4 8.2 8.079 7.475 7.233 12.775 11.301 12.041 10.656 9.744 2MASS J05015057+0345551 75.4612061 3.7648361 10.01 2.18 32 0 51.7 7.8 1.0 142.0 8.2 -139.4 8.2 8.079 7.475 7.233 12.775 11.301 12.041 10.656 9.744 TYC 3337-1716-1 65.8618519 49.5711306 10.39 2.38 101 0 52.5 4.0 1.9 -22.5 3.8 -210.2 3.7 8.329 7.720 7.512 13.334 11.783 12.537 11.190 10.051 G 141-10 276.6024736 11.3482256 11.31 3.03 60 0 52.2 8.3 1.6 -5.5 5.8 -273.2 5.2 8.918 8.368 8.127 14.304 12.875 13.511 12.330 10.970 LP 415-18 65.4591900 21.3277058 11.48 2.30 57 2 52.0 7.0 1.6 113.1 5.5 -228.3 5.4 9.080 8.431 8.205 14.612 13.035 13.779 12.450 11.617 LSPM J0018+2603 4.6548539 26.0513139 12.09 2.12 48 0 51.4 8.2 1.0 -140.2 4.3 -83.0 4.2 9.765 9.203 8.929 15.210 13.659 14.393 13.066 11.701 G 86-7 71.1550842 29.8203850 11.87 2.22 83 1 53.0 4.7 2.8 -123.7 3.8 -207.3 3.6 9.640 9.090 8.811 14.943 13.369 14.128 12.749 11.525 SCR 1757-0407 269.3571789 -4.1203722 13.32 2.13 23 0 54.1 27.5 3.9 20.0 7.5 -262.5 5.7 11.203 10.676 10.466 · · · · · · · · · · · · · · · a LSPM J1240+1946 190.0778742 19.7694197 12.98 2.98 86 0 51.2 7.6 1.0 -173.8 4.4 -125.8 3.9 10.564 9.955 9.718 16.164 14.607 15.339 13.903 12.526 LHS 5268 213.6098250 23.4575911 11.94 3.03 117 2 51.0 4.4 0.9 -176.2 3.6 -454.5 3.4 9.516 8.915 8.628 15.114 13.458 · · · · · · · · · LP735-024 189.7161336 -10.0442386 12.46 2.09 24 0 51.3 26.2 1.2 -338.5 16.7 73.2 16.1 9.979 9.432 9.131 15.639 14.069 14.817 13.469 11.953 G 114-33 136.2672047 2.8343731 10.26 1.21 35 0 51.1 13.0 0.9 -312.5 14.3 36.9 14.3 8.177 7.545 7.313 13.112 11.618 12.340 10.999 9.928 G 160-054 63.4420903 -5.1518606 12.32 2.07 51 0 51.0 5.9 1.0 181.6 5.9 -100.2 5.8 9.716 9.114 8.823 15.901 14.175 14.970 13.587 11.967 LHS 3514 300.9934797 -8.1306786 11.89 1.29 31 0 50.9 17.3 1.1 -487.4 21.4 -221.5 13.5 9.184 8.581 8.286 · · · · · · · · · · · · · · · LSPM J0123+0257E 20.8139186 2.9536786 14.63 2.04 17 0 50.8 13.2 1.0 290.7 10.1 77.7 9.9 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J2113+0846N 318.4363344 8.7692233 10.53 1.97 31 0 50.6 13.2 0.9 153.3 12.3 -94.8 12.3 8.384 7.768 7.498 13.016 11.407 12.175 10.944 9.862 LDS 852(GJ 1142A) 167.0270578 -5.2314881 11.27 1.11 45 0 50.8 9.8 1.1 -88.7 10.7 -482.8 10.2 8.797 8.137 7.933 14.117 12.578 13.314 12.001 10.758

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

LP 42-305 242.6168719 73.9103031 13.30 3.08 152 1 50.4 4.9 0.8 -221.3 2.6 269.5 2.7 10.683 10.104 9.852 17.113 15.223 16.219 14.680 12.999 G 159-010 28.4580203 3.2229294 13.35 2.04 30 0 50.5 11.0 1.0 339.4 7.4 47.0 7.2 10.587 9.976 9.701 17.010 15.300 16.043 14.638 12.927 LHS 5168 155.0010808 28.9527031 11.49 2.94 103 2 50.7 5.1 1.2 -471.1 4.1 -198.6 4.0 9.159 8.631 8.361 14.632 12.991 13.795 12.419 11.118 SCR 0909-0611B 137.3912817 -6.1963444 11.91 1.21 51 0 50.4 14.1 0.9 -140.0 19.7 0.2 19.5 10.441 9.846 9.620 14.312 12.870 13.622 12.269 11.615 G 58-21 162.1367117 19.1502008 11.88 2.10 74 1 50.5 6.4 1.1 227.3 4.4 -108.9 3.9 9.491 8.925 8.677 15.078 13.471 15.053 12.888 11.866 2MASS J04145348+2745284 63.7240375 27.7573144 11.18 2.38 76 2 51.1 5.4 1.8 232.5 4.0 -121.0 3.7 8.763 8.146 7.901 14.351 12.741 13.487 12.125 10.754 LP 455-12 304.6866844 15.8458844 10.35 2.62 42 0 51.0 8.0 1.7 191.9 8.1 -60.3 8.0 8.174 7.590 7.367 13.229 11.751 12.462 11.216 9.981 Ross 164 291.2862358 28.3552692 9.95 3.04 59 0 52.7 5.6 3.4 208.4 4.0 381.0 3.9 8.442 7.868 7.552 · · · · · · · · · · · · · · · SCR 1127-0707 171.9333069 -7.1194806 14.79 1.05 13 0 50.5 20.4 1.2 -208.1 21.9 83.7 21.9 13.012 12.372 12.196 · · · · · · · · · · · · · · · 2MASS J00531297+1903270 13.3035869 19.0568858 10.93 2.08 38 0 50.2 9.9 0.9 -98.5 5.6 -129.8 5.5 8.792 8.199 7.912 13.920 12.443 13.159 11.841 10.706 TYC 3529-1437-1 274.3544244 48.3675247 10.06 2.11 57 1 50.1 7.5 0.9 -47.3 5.7 44.0 5.7 7.770 7.173 6.952 12.810 11.370 12.045 10.754 9.750 PM I19243+4237 291.0869597 42.6238864 11.89 3.03 79 3 50.3 3.9 1.3 -85.7 3.2 40.7 3.1 9.335 8.702 8.457 15.017 13.536 14.127 12.921 11.543 G 150-7 202.9595383 23.3891631 10.83 2.98 95 1 50.0 5.7 1.0 -267.4 4.1 51.9 4.0 8.608 8.004 7.815 13.850 12.247 13.033 11.643 10.512 G 114-14 130.5964486 -4.8997344 11.33 2.32 59 1 50.0 9.5 1.0 -52.0 8.2 -307.4 7.7 9.047 8.544 8.186 14.386 12.826 13.567 12.223 10.958 G 100-57 91.1647906 27.8963472 11.28 2.31 84 0 50.4 5.3 1.5 34.4 3.5 -373.1 3.4 9.066 8.425 8.154 14.305 12.786 13.536 12.199 10.953 NLTT 58073 357.3127028 10.0925156 11.95 2.08 48 0 49.9 10.5 1.1 28.7 5.3 -383.2 5.0 9.459 8.920 8.676 15.102 13.849 14.287 13.019 11.475 LP740-010 216.3907531 -11.8143967 11.88 1.08 18 0 49.9 23.3 1.0 -300.6 26.0 -6.8 25.8 9.353 8.702 8.391 15.099 13.510 14.204 12.903 11.450 LHS 2292 159.6359842 35.4981989 10.87 2.25 110 1 49.9 5.4 1.0 -438.6 3.6 266.7 3.6 8.676 8.069 7.823 13.928 12.307 13.086 11.760 10.550 2MASS J04325718+7407002 68.2395917 74.1162072 10.45 2.39 147 12 49.8 8.1 1.0 86.3 7.2 -119.2 7.3 8.245 7.609 7.386 13.368 11.848 12.610 11.247 10.113 G 74-12 34.3564561 33.3904836 12.17 2.34 115 1 49.8 3.4 1.0 437.0 3.1 -12.7 3.1 9.751 9.192 8.925 · · · · · · · · · · · · · · · NLTT 40208 231.4315283 31.2022978 13.64 2.99 95 0 49.9 4.7 1.1 16.3 3.4 -248.8 3.1 10.651 10.045 9.699 17.708 15.707 16.461 15.061 13.121 G 49-22 145.7965978 21.4402197 12.54 2.32 72 0 49.9 8.3 1.1 -263.3 4.5 -9.4 4.5 10.114 9.524 9.238 15.902 14.248 14.972 13.645 12.188 ZEH2003 RX J0916.1+01 139.0425953 1.8854312 11.32 1.13 34 0 49.8 9.8 1.0 49.6 12.0 -91.3 12.0 8.770 8.258 7.960 14.601 13.028 13.754 12.405 10.905 NLTT 15320 84.8556036 74.7672803 11.74 2.46 138 0 49.9 4.3 1.2 15.7 3.9 -144.2 3.8 9.330 8.713 8.453 14.953 13.349 14.103 12.747 11.336 NLTT 56971 352.0944564 0.4776275 11.60 2.06 35 1 49.7 10.7 1.0 178.2 6.6 -1.1 5.7 9.374 8.790 8.519 14.773 13.258 13.964 12.677 11.399 LTT 13962 204.2305556 22.9662792 11.21 2.98 93 2 49.8 5.9 1.1 99.8 3.5 -165.8 3.4 8.979 8.426 8.141 14.276 12.715 13.442 12.051 10.869 LP 461-11 348.4482339 21.2913392 14.63 2.19 32 0 49.7 10.6 1.1 251.9 5.1 -33.1 5.1 11.421 10.761 10.443 · · · · · · · · · · · · · · · G 139-50 264.7132556 8.0256003 10.85 3.02 63 0 49.5 12.8 0.9 -80.0 4.8 -219.1 4.7 8.702 8.107 7.847 13.811 12.230 13.004 11.627 10.516 TYC 796-882-1 126.8786625 8.6207503 10.71 2.35 37 0 49.5 7.5 0.9 -49.9 6.8 107.0 6.2 8.444 7.835 7.581 13.601 12.142 12.817 11.591 10.358 SCR 0634-0753 98.5986906 -7.8885467 11.31 1.14 40 0 49.8 10.1 1.3 -353.4 20.1 134.9 15.7 9.344 8.741 8.520 14.210 12.573 13.385 11.961 11.052 G 229-30 289.4931686 58.9820253 11.84 3.07 131 3 49.8 3.7 1.3 -149.6 3.0 -357.1 3.0 9.475 8.906 8.638 15.030 13.468 14.114 12.807 11.484 G 237-51 183.0576386 71.4240542 11.33 3.07 157 0 49.6 4.3 1.1 -373.0 3.4 167.5 3.4 8.815 8.212 8.001 14.311 12.827 13.546 12.223 10.803 LSPM J0930+3937 142.5075503 39.6225986 10.94 2.37 87 1 49.8 4.7 1.3 119.9 4.2 -168.1 4.2 8.467 7.886 7.650 13.685 12.157 12.860 11.542 10.400 G 115-25 131.5212728 38.2303814 13.14 2.39 97 3 49.5 4.1 1.0 -272.6 3.6 -147.8 3.6 10.529 9.978 9.722 16.484 14.920 15.631 14.259 12.713 G 68-13 350.8529700 15.5693703 10.34 2.13 27 0 49.4 16.2 1.0 -1.3 7.2 -478.9 7.1 8.255 7.652 7.438 13.084 11.660 12.357 11.085 10.073 G 14-8 193.3295511 -5.3318889 11.30 2.07 31 0 49.5 8.9 1.1 -370.3 6.1 -173.7 5.8 8.919 8.373 8.116 14.347 12.851 13.575 12.252 10.919 2MASS J09264503+0857421 141.6883044 8.9613156 13.20 1.21 45 0 49.2 9.5 1.0 172.7 11.1 -89.7 10.8 10.350 9.787 9.436 17.101 15.220 16.025 14.596 12.798 LHS 3299 263.2212486 54.3385100 10.92 3.08 111 1 48.9 5.1 0.8 -264.0 3.2 428.9 3.2 8.935 8.383 8.184 13.720 12.189 12.940 11.591 10.604 G 150-46 208.1511014 14.4211478 10.24 2.96 84 0 49.3 7.2 1.2 44.2 6.0 -284.8 5.7 8.013 7.321 7.144 13.144 11.651 12.372 11.050 9.875 UPM 1316-0858 199.1687036 -8.9739806 12.75 2.08 31 0 49.2 13.0 1.1 -70.2 7.4 -56.8 7.4 10.043 9.500 9.199 16.325 14.554 15.369 13.925 12.357 LP 313-38 139.6716733 26.7631303 14.38 2.31 43 1 49.2 8.0 1.1 -182.7 7.1 -356.6 7.1 11.269 10.619 10.291 · · · · · · · · · · · · · · · 2MASS J05530180+2507440 88.2579853 25.1280483 10.82 2.31 58 0 49.1 6.5 1.1 82.3 5.1 -171.0 5.0 8.552 7.924 7.679 13.945 12.390 13.112 11.769 10.507 SCR 0545-0601 86.4548300 -6.0296000 10.22 1.09 28 0 49.6 10.7 1.6 126.5 19.3 -99.4 18.6 9.084 8.590 8.503 11.748 10.775 11.242 10.467 10.150 LHS 1332 31.1124203 -1.8848019 12.09 1.17 29 0 49.1 12.5 1.1 -637.3 29.3 -569.4 29.3 9.585 9.092 8.804 15.474 13.797 14.555 13.206 11.731 2MASS J09554360+3521421 148.9314986 35.3601606 11.24 2.32 110 1 49.1 3.7 1.2 -35.0 4.1 -318.6 4.0 8.850 8.297 8.043 14.424 12.813 13.565 12.213 10.888 SCR 2247-1107 341.9000200 -11.1193483 12.14 1.26 18 0 48.9 18.6 1.1 159.8 23.1 -108.7 21.2 10.499 9.840 9.661 14.297 13.019 13.655 12.473 11.849 LP 445-56 245.4083219 17.2249611 9.95 3.06 63 0 48.9 9.8 1.1 -40.3 6.6 -257.8 6.6 8.149 7.535 7.366 11.901 10.594 · · · · · · · · · G 179-55 236.8626261 45.1318136 11.77 3.07 140 2 48.9 4.0 1.1 -253.1 2.8 200.3 2.8 9.082 8.463 8.215 15.199 13.606 14.366 12.970 11.487 2MASS J12153937+5239088 183.9146958 52.6524267 11.07 3.06 135 1 48.8 4.2 1.0 99.9 3.2 4.6 3.2 8.588 7.993 7.757 14.252 12.564 13.402 11.936 10.634 G 88-4 106.2060075 24.9974903 10.30 2.35 60 0 48.7 6.0 1.1 -179.6 5.0 -271.6 5.0 8.273 7.642 7.417 13.087 11.559 12.297 10.968 10.009 LSPM J1007+1514 151.8946397 15.2370875 13.56 2.09 72 0 48.6 11.2 1.1 58.5 5.7 -180.5 5.5 11.285 10.721 10.482 16.580 15.034 15.741 14.453 13.194 LHS 6274 223.0671878 41.3216500 11.84 3.03 127 2 48.4 3.8 1.0 -447.3 2.9 -65.2 2.6 9.542 8.976 8.719 15.116 13.367 14.255 12.719 11.518 LHS 2274 157.5967164 32.8354153 11.17 2.24 100 0 48.5 5.7 1.1 -404.7 4.1 -386.2 4.2 8.867 8.301 8.089 14.207 12.703 13.414 12.152 10.841 2MASS J06014571+1305015 90.4398633 13.0835372 10.60 2.29 56 3 48.5 5.2 1.1 -129.3 4.9 -39.2 4.8 8.444 7.826 7.588 13.468 12.043 12.715 11.468 10.270 G 141-046 283.3568978 2.8471433 10.96 3.03 49 0 50.3 8.0 3.0 298.8 5.6 20.9 5.3 8.834 8.335 8.104 13.939 12.378 13.130 11.767 10.656 G 63-50 205.7539861 9.0727731 11.52 2.97 103 1 48.2 7.4 0.9 -337.6 4.6 -110.1 4.0 9.093 8.485 8.200 14.714 13.142 13.905 12.548 11.066 2MASS J10242017+1157207 156.0841167 11.9564472 11.02 1.94 74 2 48.4 6.6 1.1 -15.9 5.0 177.6 4.8 8.847 8.292 8.022 14.014 12.482 13.169 11.892 10.707 LTT 06128 230.3930961 -2.2839228 10.18 2.12 52 0 48.3 11.6 1.1 28.2 7.3 -272.7 7.3 8.146 7.524 7.255 12.838 11.351 12.081 10.753 9.797 2MASS J05303723+1514286 82.6546089 15.2407097 11.26 2.18 50 5 48.9 6.5 1.8 -119.5 4.7 -129.9 4.6 8.985 8.404 8.167 14.334 12.801 13.526 12.195 10.938 LP 664-22 122.9684778 -8.9196492 11.82 2.32 36 0 48.0 10.3 0.9 -203.9 11.4 168.5 11.4 9.457 8.854 8.602 14.996 13.449 14.149 12.826 11.472 G 104-47 99.0501300 20.1362883 11.63 2.30 80 0 47.9 4.8 0.9 90.6 4.0 -215.8 4.0 9.434 8.854 8.594 14.720 13.083 13.994 12.495 11.277 GIC 101 176.2982172 18.3483919 11.66 2.85 89 1 48.1 7.0 1.1 -289.4 4.7 -290.7 4.5 9.162 8.530 8.260 14.831 13.320 13.995 12.749 11.266 PM I07129+3547 108.2483697 35.7842169 11.25 2.40 115 0 48.0 5.0 1.0 62.9 4.0 -5.5 4.1 8.834 8.257 8.053 14.031 12.489 13.234 11.891 10.722 G 14-18 195.0151478 -5.6298083 11.04 2.07 31 0 48.0 15.4 1.1 -339.7 10.0 34.9 9.7 8.655 8.035 7.780 14.118 12.581 13.287 12.013 10.634

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

LSPM J1043+2620 160.9805317 26.3445675 12.41 2.24 91 1 48.0 5.9 1.1 -81.3 3.6 -161.6 3.5 10.055 9.505 9.251 15.472 14.047 14.730 13.480 12.067 2MA1849-0134 282.4810283 -1.5699836 12.03 3.00 38 0 50.9 9.0 4.1 15.5 5.0 -178.3 4.8 9.784 9.107 8.841 14.780 13.439 14.082 12.835 11.593 2MASS J14194671+3137037 214.9451478 31.6176306 12.59 3.05 114 1 48.1 3.7 1.3 104.2 2.6 -27.6 2.4 10.007 9.415 9.158 16.080 14.325 15.080 13.727 12.080 LP 213-67 161.8009778 40.4453250 14.96 2.19 38 0 47.8 9.3 1.0 -283.9 7.9 -28.1 7.7 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J2010+5610 302.6919367 56.1782089 9.62 2.72 50 1 47.9 6.1 1.2 -30.2 5.5 -167.6 5.1 7.869 7.261 7.079 12.015 10.679 11.302 10.089 9.405 SCR 1408-0146 212.0488511 -1.7827354 15.92 2.09 10 0 47.7 21.8 1.0 -227.0 11.8 -1.5 11.1 · · · · · · · · · · · · · · · · · · · · · · · · LP 447-38 259.5934967 18.1481147 11.49 3.04 87 0 47.5 9.0 0.9 -10.9 4.1 -237.8 3.9 9.050 8.495 8.232 14.666 13.111 13.832 12.487 11.025 G 14-34 197.2118911 -1.5186892 11.24 2.05 41 0 47.7 14.4 1.1 -392.2 9.7 -3.3 8.7 8.920 8.335 8.081 14.293 12.758 13.487 12.187 10.883 LHS2186 146.5367164 -4.4279678 12.30 1.21 39 0 47.5 10.4 0.9 -569.1 18.5 158.0 18.2 9.688 9.154 8.832 15.827 14.099 14.946 13.442 11.831 G 234-57 138.3477014 68.8742886 9.85 2.93 95 1 47.5 5.6 0.9 -170.4 5.5 -231.5 5.5 7.775 7.142 6.902 12.767 11.168 12.021 10.537 9.475 G 132-4 8.3379711 36.8411617 11.07 2.27 58 0 47.4 5.5 0.9 507.9 4.2 127.0 4.2 8.768 8.085 7.849 14.194 12.658 13.392 12.063 10.734 G 205-48 284.2523728 47.3397564 11.83 3.07 101 5 47.6 4.8 1.1 36.1 3.8 -406.6 3.7 · · · · · · · · · 14.878 13.318 · · · · · · 11.562 LHS 5398 349.0210419 57.3760961 9.80 2.05 41 0 48.1 11.1 1.7 532.1 6.3 109.6 6.3 8.018 7.368 7.209 12.210 10.846 11.562 10.285 9.549 G 144-63 316.3435775 20.8592192 11.74 2.06 37 0 47.5 5.8 1.1 269.4 5.3 -86.5 5.3 9.421 8.871 8.657 14.855 13.248 13.976 12.612 11.324 SCR 1757-0113 269.3088889 -1.2243706 12.04 3.05 51 1 48.6 13.5 2.2 196.2 4.2 -100.3 4.0 10.595 9.970 9.855 13.880 12.781 13.316 12.323 11.833 LHS 3057 229.8227197 67.8563797 11.83 3.04 158 1 47.3 4.1 0.9 -465.8 2.5 402.0 2.5 9.568 8.990 8.773 15.049 13.430 14.198 12.796 11.412 G 221-20 55.9332239 72.8953150 13.19 2.39 123 0 47.4 3.6 1.1 204.5 3.3 -437.5 3.3 10.624 10.024 9.737 16.586 14.878 15.727 14.325 12.722 G 157-056 351.0248842 -5.1870106 11.96 1.97 47 1 47.3 9.7 1.0 358.3 6.8 11.4 5.5 9.559 8.938 8.693 15.158 13.611 14.329 13.041 11.656 G 13-39 186.9350556 -3.2503514 11.23 2.04 45 0 47.3 12.3 1.0 -296.6 10.1 -27.4 9.4 8.763 8.123 7.852 14.382 12.837 13.554 12.243 10.746 LP 486-49 136.5575564 12.8585503 11.71 2.31 54 1 47.3 6.3 1.0 -291.0 5.5 -277.2 5.3 9.243 8.636 8.352 14.950 13.402 14.188 12.760 11.293 LP702-096 351.9820353 -5.4502778 11.95 1.97 32 0 47.2 10.8 1.0 205.1 8.0 -24.8 6.7 9.680 9.054 8.777 15.098 13.570 14.286 13.017 11.700 LHS 2695 198.2670717 20.1913242 11.37 2.98 107 0 47.2 5.8 1.0 -606.1 4.3 154.7 4.1 8.867 8.252 8.019 14.543 12.979 13.718 12.348 14.203 LSPM J0644+7206 101.1246972 72.1133883 16.13 2.33 20 0 47.1 11.6 0.9 -48.3 9.4 -234.6 8.6 · · · · · · · · · · · · · · · · · · · · · · · · LP 462-52 352.7231628 15.7942167 10.37 2.19 37 0 47.1 8.5 1.0 -157.8 4.9 -117.3 4.8 8.413 7.810 7.606 13.021 11.585 12.315 10.962 10.029 LSPM J1909+3910 287.3815233 39.1801817 10.71 3.05 84 1 47.1 4.1 1.0 -115.9 2.9 -179.1 2.9 8.841 8.239 8.028 13.211 12.179 · · · · · · · · · G 183-13 269.2641453 15.7776764 10.76 3.04 71 0 47.8 6.9 1.8 -170.4 4.3 -236.7 4.3 8.329 7.752 7.514 13.741 12.236 12.917 11.639 10.258 LHS 2645 193.3030575 40.5649128 16.09 2.86 24 0 47.3 11.7 1.3 225.8 7.9 -643.3 7.6 · · · · · · · · · · · · · · · · · · · · · · · · LP 427-16 138.5126431 19.6677019 10.71 2.31 38 0 47.0 10.0 1.0 -157.3 7.8 -159.4 6.7 8.424 7.824 7.535 13.707 12.171 12.898 11.568 10.374 2MASS J18550451+4259510 283.7690792 42.9975167 12.53 3.06 112 0 47.0 3.6 1.1 43.4 3.0 17.4 3.0 9.780 9.217 8.922 15.897 14.348 15.028 13.679 12.203 LP 330-013 246.3870694 32.3093842 11.02 3.04 91 0 46.7 5.8 1.0 72.2 3.6 167.6 3.5 8.868 8.279 8.051 13.775 12.536 · · · · · · · · · UPM 1600-0137 240.0562867 -1.6206836 12.07 3.01 74 0 46.8 8.0 1.1 113.5 4.2 -173.5 3.9 9.820 9.247 8.981 15.205 13.560 14.346 12.941 11.705 SCR 1447-0805 221.9905692 -8.0851925 12.04 2.08 43 1 46.7 12.1 1.0 -118.6 5.7 -71.8 5.8 10.532 9.868 9.764 13.991 12.819 13.412 12.313 11.901 NLTT 18279 115.5417586 50.0745083 10.65 2.39 89 1 46.6 5.8 0.9 213.3 5.1 64.8 5.0 8.455 7.867 7.619 13.718 12.074 12.876 11.462 10.283 LHS 5075 54.7951422 7.9993517 11.70 2.19 58 1 47.0 5.8 1.4 199.3 5.1 -449.6 5.1 9.390 8.828 8.582 14.836 13.224 13.989 12.606 11.352 G 29-29 351.1166086 10.2916269 13.40 2.13 41 0 47.0 14.7 1.4 -109.3 5.4 -330.5 5.3 10.752 10.246 9.952 16.589 15.265 15.695 14.775 13.001 LHS 1204 17.3809622 21.6265119 12.62 2.18 65 0 46.4 6.1 0.8 141.8 3.5 -527.3 3.5 10.087 9.534 9.272 15.846 14.358 15.029 13.767 12.370 LSPM J0631+5002 97.7541272 50.0460819 9.85 2.35 75 4 46.5 6.1 1.0 -107.5 4.4 -162.0 4.3 7.873 7.246 7.063 12.545 11.063 11.839 10.454 9.571 G 210-11 304.1336272 35.1773294 10.97 2.92 74 1 47.0 4.6 1.6 -85.4 4.1 -325.6 4.1 8.905 8.302 8.083 13.801 12.306 13.032 11.724 10.655 2MASS J19405202+7831418 295.2122522 78.5280203 13.20 3.05 148 0 46.4 3.9 1.0 -184.6 2.9 -39.2 2.9 10.356 9.765 9.466 16.904 15.253 15.877 14.533 12.739 G 224-20 221.1034147 58.2878761 13.73 2.94 97 0 46.3 4.5 0.9 -255.9 3.5 184.1 3.5 10.927 10.409 10.061 17.978 15.968 16.643 15.131 13.360 G 246-29 48.6379517 59.4372342 10.70 2.35 96 1 47.4 3.7 2.1 186.5 3.4 -164.1 3.5 8.448 7.844 7.608 13.823 12.205 12.930 11.574 10.341 G 29-19 349.3946967 6.3902558 11.04 1.99 35 0 46.3 13.7 0.9 176.8 8.6 -243.4 7.7 8.776 8.186 7.878 14.157 12.606 13.378 11.982 10.745 LSPM J1504+4858 226.0250339 48.9815317 12.77 3.06 134 2 46.3 4.1 1.1 -176.1 2.9 -23.0 2.7 10.167 9.536 9.307 16.238 14.543 15.355 13.944 12.423 G 123-32 186.4112378 45.7631894 11.54 3.05 122 3 46.5 4.3 1.2 -194.4 2.9 -269.1 2.9 9.301 8.760 8.523 14.297 12.864 13.525 12.264 11.271 TYC 2723-908-1 330.3087472 32.3871492 10.80 2.10 48 1 46.3 7.7 1.1 114.4 5.6 53.9 5.5 8.829 8.205 7.980 13.882 12.131 13.001 11.477 10.495 LTT 06368 239.6152553 -6.8633136 11.31 2.12 51 1 46.2 11.6 1.1 -134.8 7.2 -205.4 7.1 8.679 8.116 7.811 13.854 12.386 13.083 11.773 10.577 LHS2804 207.1709456 -5.2873717 13.03 2.10 53 0 46.3 8.6 1.1 246.8 4.7 -460.9 4.6 10.329 9.701 9.403 · · · · · · · · · · · · · · · SCR 0627-0420 96.8342478 -4.3430847 13.55 0.99 20 0 46.3 10.3 1.2 -178.8 18.6 -303.3 14.6 11.741 11.237 11.047 16.255 14.701 15.542 14.019 13.194 G 235-43 147.3537539 65.1400258 12.41 2.38 161 2 46.1 3.2 1.0 -231.5 3.3 62.3 3.3 9.983 9.430 9.156 15.688 14.060 14.822 13.405 12.025 LP 35-220 127.8231714 72.6239953 11.14 2.42 89 2 46.0 4.8 0.9 108.1 4.6 -332.4 4.4 9.043 8.498 8.284 13.952 12.462 13.288 11.896 10.825 G 33-6 11.0817214 12.6166847 11.22 2.02 48 0 46.1 11.7 1.1 284.6 7.0 -179.9 6.5 8.868 8.301 8.083 14.298 12.835 13.516 12.293 10.916 G 129-49 359.4789244 21.9908700 11.95 2.24 53 1 46.1 6.7 1.1 369.8 3.7 -63.8 3.6 9.554 8.912 8.645 15.200 13.638 14.333 13.021 11.616 LSPM J2001+0016 300.2758372 0.2701731 10.20 1.22 17 0 46.3 22.7 1.3 18.3 25.9 -246.9 24.2 8.106 7.488 7.206 · · · · · · · · · · · · · · · G 170-42 262.5943492 19.2085350 12.03 3.04 94 1 45.9 7.8 0.9 384.7 3.1 -105.2 3.0 9.767 9.220 8.944 15.156 13.507 14.290 12.876 11.624 LP 310-29 121.2234014 27.0850442 11.51 2.36 83 0 46.0 4.5 1.0 -257.6 3.8 -218.1 3.7 9.407 8.792 8.569 14.497 12.969 13.669 12.347 11.187 LP 141-7 282.8429831 53.0242378 12.91 3.08 121 0 45.7 3.1 0.8 -48.9 2.5 271.8 2.5 10.307 9.699 9.411 16.531 14.684 15.508 14.093 12.534 G 196-3 151.0887183 50.3863464 10.24 2.93 83 0 45.9 5.3 1.0 -142.3 5.2 -207.3 5.2 8.081 7.413 7.199 13.175 11.674 12.385 11.059 9.911 LP 571-80 284.2934622 7.5708547 10.25 2.09 50 0 47.0 9.5 2.2 -137.3 10.8 -127.7 10.6 8.331 7.745 7.565 12.843 11.425 12.130 10.843 10.004 UPM 1802+2107 270.5169867 21.1214161 10.91 3.04 77 2 45.9 6.6 1.1 33.1 3.7 20.0 3.7 8.707 8.094 7.863 13.853 12.319 13.061 11.736 10.592 SCR 0905-0841 136.4316592 -8.7001794 13.79 1.94 29 0 45.8 9.9 1.0 310.6 12.9 -170.5 12.8 10.828 10.241 9.961 · · · · · · · · · · · · · · · PM I16544+0818 253.6089464 8.3036561 11.23 3.06 78 0 45.6 8.2 0.9 -68.1 4.8 -26.5 4.8 9.065 8.404 8.204 14.151 12.642 13.368 12.056 10.909 G 179-7 225.2999792 35.4528711 10.83 3.05 108 1 45.6 4.5 1.0 150.8 3.8 -275.1 3.8 8.670 8.040 7.832 13.537 11.974 12.765 11.424 10.389 TYC 4295-701-1 9.4234336 68.3605836 10.42 2.45 94 0 47.0 5.1 2.5 -46.6 4.4 -33.8 4.4 8.169 7.576 7.347 13.347 11.837 12.578 11.263 10.074 G 106-2 87.1006322 7.7596703 12.41 2.17 60 0 45.8 4.2 1.3 67.6 4.6 -277.0 4.6 9.784 9.136 8.877 15.735 14.200 14.914 13.615 12.028

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

LSPM J0533+3740 83.3194608 37.6723506 16.35 2.24 11 0 45.8 15.4 1.3 132.2 14.0 -483.0 13.4 · · · · · · · · · · · · · · · · · · · · · · · · G 246-35 51.6306333 59.1475039 13.17 2.35 91 0 46.3 4.0 1.8 179.5 3.4 -191.7 3.3 10.459 9.876 9.592 · · · · · · · · · · · · · · · UPM 2336+2613 354.2231250 26.2310497 12.09 2.24 75 0 45.5 5.5 1.0 -16.2 3.2 -34.9 3.2 9.654 9.102 8.849 15.343 13.695 14.476 13.092 11.680 UPM 1928+4801 292.0901206 48.0264142 11.54 3.04 89 0 45.6 4.8 1.1 -30.5 3.7 5.4 3.8 9.136 8.591 8.342 14.807 12.973 13.876 12.483 11.213 LSPM J0120+3302 20.1196633 33.0442336 15.88 2.19 20 0 45.5 15.0 1.1 242.5 11.5 25.4 11.2 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J0817+3107 124.4632806 31.1303969 9.95 2.34 59 0 45.6 6.9 1.1 -75.9 6.9 232.6 6.5 7.943 7.322 7.090 12.660 11.121 11.907 10.552 9.633 LHS 3795 335.1163031 12.2494831 12.31 2.06 38 0 45.4 18.2 1.0 516.2 5.9 -138.8 5.8 9.908 9.411 9.147 15.392 13.892 14.587 13.345 11.981 LSPM J0335+1133 53.9297794 11.5561228 11.89 2.20 64 0 45.9 6.8 1.6 172.4 5.5 -15.1 5.5 9.559 8.960 8.699 14.938 13.421 14.143 12.790 11.589 UPM 2310+6641 347.5250261 66.6976978 12.53 2.33 116 0 46.9 4.3 2.6 -41.6 3.2 -99.4 3.1 9.944 9.373 9.109 15.870 14.282 15.033 13.677 12.189 PM I15210+3057 230.2524086 30.9502508 11.15 3.05 128 3 45.5 4.2 1.2 -94.2 3.0 -15.3 2.9 8.963 8.380 8.129 14.054 12.514 13.246 11.930 10.744 G 104-52 100.0228972 28.5862500 11.13 2.31 64 2 45.6 6.3 1.3 30.9 4.7 -230.2 4.6 8.270 7.674 7.430 13.412 11.858 12.644 11.257 10.111 LSPM J0228+1538 37.1962872 15.6481961 10.92 2.15 51 1 45.3 8.5 1.1 170.5 5.7 0.8 5.7 8.792 8.158 7.960 13.741 12.337 12.987 11.670 10.653 G 35-39 34.6496706 20.7958583 11.01 2.29 56 2 45.3 8.5 1.1 -25.4 4.8 -291.1 4.8 8.844 8.333 8.022 13.969 12.399 13.165 11.800 10.634 LHS 6199 168.8024294 19.4514775 11.30 2.06 71 0 45.3 7.5 1.1 193.3 5.6 -483.1 5.4 8.919 8.366 8.086 14.435 12.925 13.643 12.323 10.894 G 241-20 341.3837617 63.2627908 11.31 2.33 87 0 47.1 5.4 3.0 -160.6 4.0 163.1 3.8 9.185 8.611 8.355 14.275 12.746 13.465 12.208 11.031 LHS 1037 2.9826689 33.0531669 11.39 2.19 65 1 45.2 6.9 1.1 -554.9 4.6 -399.7 4.7 · · · · · · · · · 14.589 13.003 13.730 12.420 11.044 G155-020 277.7682722 -9.9683250 12.37 2.11 22 0 48.0 15.6 3.9 33.8 13.4 252.8 12.7 9.989 9.362 9.115 15.617 14.017 14.693 13.417 11.983 a G 150-72 213.4711742 24.7987883 11.52 3.04 121 1 44.9 4.5 0.9 -6.4 3.4 297.7 3.4 9.237 8.675 8.450 14.636 12.973 13.791 12.342 11.080 LSPM J0855+5251 133.7764303 52.8570397 13.89 2.36 102 3 45.0 3.5 1.0 -160.1 3.4 -205.9 3.3 11.037 10.431 10.153 17.536 15.821 16.602 15.139 13.391 G 264-18 331.4359914 65.6495936 10.43 2.32 70 1 45.5 5.9 1.6 -321.9 5.1 216.0 4.9 8.422 7.807 7.616 13.157 11.621 12.377 11.001 10.023 G 82-48 71.7982022 2.1609969 10.18 2.18 34 0 44.8 9.8 1.0 -205.6 9.7 -14.7 9.7 8.308 7.674 7.451 12.799 11.310 12.065 10.674 9.937 UPM 1840+1923 280.2026967 19.3959783 11.27 3.04 63 0 45.0 7.3 1.3 25.6 4.7 -33.1 4.6 8.890 8.342 8.093 14.421 12.819 13.599 12.229 10.902 GSC 02069-01374 257.6061517 27.9774436 11.38 3.06 90 2 44.6 5.1 0.8 23.7 2.3 -87.4 2.2 8.987 8.387 8.155 14.153 12.537 13.393 11.917 10.780 StKM 1-626 107.1655164 30.7143022 10.45 2.36 66 0 44.8 8.4 1.1 161.7 5.7 96.9 5.7 8.329 7.657 7.442 12.822 11.354 12.088 10.751 9.893 UPM 1149-0019B 177.2605419 -0.3233422 12.40 1.96 56 0 44.8 12.4 1.2 -202.2 10.3 2.6 8.1 9.963 9.345 9.145 13.975 13.047 13.538 12.825 12.067 Wolf 132 47.9509067 19.6698778 9.91 2.23 33 0 44.6 8.6 1.1 221.5 9.2 -222.0 9.0 8.044 7.435 7.240 12.531 11.164 11.786 10.506 9.753 Ross 1064 293.9627625 41.3185219 9.36 2.01 33 0 44.6 10.1 1.1 -297.0 6.8 -72.8 6.8 7.563 6.928 6.770 11.885 10.405 11.213 9.802 9.239 LP 51-17 15.2039581 66.9483458 11.74 2.35 99 2 46.3 4.5 2.8 -237.5 3.5 -51.8 3.3 9.408 8.726 8.484 14.986 13.425 14.086 12.772 11.347 UPM 0954+2025 148.5650175 20.4257054 11.25 2.09 69 0 44.6 8.8 1.1 32.7 6.2 -26.5 5.9 8.911 8.314 8.016 14.365 12.783 13.503 12.150 10.849 LSPM J2256+5919 344.0571889 59.3194622 10.34 2.28 39 0 45.1 10.3 1.7 143.3 6.5 131.0 5.9 8.522 7.936 7.698 12.688 11.296 12.052 10.764 10.085 GSC 04018-02763 2.6064647 62.2105539 12.11 2.34 100 0 44.9 4.2 1.5 -36.6 3.4 37.1 3.4 9.655 9.092 8.811 15.394 13.803 14.514 13.221 11.841 LHS 2672 195.6947903 41.5186872 11.42 3.07 103 2 44.5 5.5 1.1 -548.8 3.7 -175.1 3.7 · · · · · · · · · 14.569 12.962 13.724 12.356 11.032 LSPM J0433+5635 68.3757194 56.5909683 16.36 2.34 16 0 44.9 17.6 1.6 97.4 14.1 -337.4 9.9 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J0216+0112 34.1983875 1.2126619 12.07 0.98 36 0 44.3 9.2 1.0 208.0 22.2 -12.8 22.0 9.786 9.210 8.948 15.233 13.654 14.409 13.037 11.683 LSPM J1339+0922 204.8166694 9.3756472 13.31 3.03 73 0 44.3 8.4 1.0 78.7 5.2 -324.2 4.0 10.526 9.918 9.629 16.832 15.137 15.967 14.546 12.934 G 44-41 163.0023617 4.0988692 13.11 1.90 43 0 44.4 11.0 1.1 -410.8 8.2 -98.8 6.9 10.625 10.061 9.815 16.395 14.742 15.451 14.132 12.722 LHS 2304 161.2368647 23.5766706 11.72 2.24 73 1 44.4 6.5 1.1 -610.2 4.4 -264.2 4.3 9.439 8.843 8.619 14.638 13.136 13.855 12.597 11.326 LHS 1728 75.6940725 61.5137639 12.02 2.39 129 0 44.9 3.7 1.7 586.9 3.0 6.2 3.0 · · · · · · · · · 15.043 13.657 14.235 13.083 11.648 G 39-11 66.2058661 32.4489650 10.98 2.37 67 0 44.4 5.3 1.2 220.7 4.5 -141.1 4.1 8.818 8.248 8.048 13.917 12.347 13.101 11.752 10.653 G 5-13 46.3809111 11.8310667 11.17 2.14 48 3 44.4 7.5 1.2 180.9 6.0 -326.6 5.9 9.034 8.395 8.160 13.970 12.534 13.218 11.943 10.846 G 187-33 318.8030794 25.7949258 10.66 2.06 37 1 44.3 6.9 1.1 139.4 6.9 -257.5 6.9 8.403 7.762 7.521 13.569 12.084 12.800 11.552 10.279 LSPM J0706+2624 106.6684517 26.4160428 13.79 2.36 49 0 44.2 4.7 1.0 -61.8 4.5 -138.4 4.4 10.847 10.231 9.948 17.454 15.674 16.458 15.097 13.614 G 65-53 217.0718083 5.3124806 11.50 2.13 62 0 44.0 8.5 0.9 -371.1 6.2 -74.3 6.0 8.932 8.401 8.082 14.793 13.152 13.879 12.554 11.231 LHS 1979 121.4058631 -9.5461039 13.18 2.29 16 0 44.1 10.0 1.0 468.1 9.2 -554.6 9.2 10.313 9.761 9.443 16.986 15.109 15.951 14.537 12.720 CCDM J22441+4030A 341.0257089 40.4995719 10.22 2.09 43 1 44.0 12.4 1.0 -74.2 5.5 -116.0 5.6 8.199 7.606 7.387 12.809 11.303 12.119 10.728 9.849 2MASS J03164613+3855274 49.1917681 38.9243845 11.62 2.35 88 0 44.0 3.8 1.1 -72.9 3.2 11.6 3.2 9.157 8.546 8.264 14.920 13.263 13.999 12.659 11.181 LSPM J2114+5052 318.6356075 50.8753931 10.74 2.30 78 1 44.8 5.8 2.0 200.9 4.7 0.7 4.5 8.456 7.861 7.624 13.581 11.958 12.785 11.481 10.202 LP 456-39 316.8532664 19.8473197 11.28 1.99 35 1 44.0 5.1 1.2 343.0 4.8 -141.2 4.6 9.182 8.639 8.393 14.103 12.620 13.324 12.061 11.142 G 237-61 185.4432111 68.2687628 11.09 3.06 191 6 43.8 3.7 1.0 -362.4 3.1 202.9 3.0 8.828 8.248 8.028 14.156 12.498 13.381 11.977 10.695 G 45-4 161.5158750 9.6965703 11.90 1.96 65 1 43.9 6.8 1.1 -117.9 5.0 -269.9 4.5 9.441 8.845 8.597 15.054 13.549 14.246 12.968 11.480 G 42-36 151.7397414 12.6810414 10.88 2.94 75 4 43.9 8.3 1.1 -318.3 5.9 -36.8 5.8 8.776 8.134 7.916 13.571 12.072 12.800 11.456 10.519 2MASS J09174473+4612246 139.4355942 46.2067714 10.22 2.34 79 3 43.8 4.5 1.0 -125.7 4.5 -15.5 4.5 8.126 7.490 7.245 13.135 11.581 12.370 10.958 9.933 G 2-26 17.9027708 12.0840783 10.96 2.07 54 0 43.8 9.0 1.1 2.8 5.5 -297.6 5.3 8.914 8.324 8.087 13.888 12.299 13.079 11.677 10.716 NLTT 4027 18.3336650 58.9223836 10.44 2.32 77 2 44.2 5.4 1.6 176.9 4.8 -121.1 4.8 8.409 7.770 7.570 13.124 11.704 12.404 11.071 10.144 LSPM J0326+1947 51.7286733 19.7976161 12.52 2.23 66 0 43.6 4.6 1.1 153.7 3.3 -91.5 3.3 10.054 9.442 9.188 15.675 14.106 14.837 13.489 12.129 Ross 243 350.1184658 30.6246522 9.47 2.01 28 0 43.8 10.3 1.3 380.6 8.7 53.4 8.7 7.828 7.228 7.089 11.640 10.398 11.072 9.859 9.279 G 229-20 284.4096472 53.5203894 10.92 3.08 104 2 43.5 4.5 1.0 254.0 4.3 -36.8 4.3 8.906 8.398 8.075 13.665 12.365 12.939 11.740 10.516 SCR 1836-0640 279.1726408 -6.6783869 13.69 2.10 23 0 46.0 13.2 3.5 -5.7 11.6 -218.8 10.0 11.239 10.652 10.378 · · · · · · · · · · · · · · · G 170-26 258.5058961 17.6475769 11.51 3.04 81 2 43.4 9.4 0.9 -45.5 4.1 -259.5 3.8 9.283 8.691 8.452 14.544 13.010 13.748 12.442 11.179 LP 138-20 255.2992106 55.5827089 11.38 3.08 115 0 43.5 6.1 1.0 166.3 2.9 -185.5 2.9 9.152 8.576 8.341 14.444 12.788 13.612 12.183 10.991 G 253-53 174.5845111 81.8087964 10.61 3.02 127 4 43.4 4.5 0.9 430.4 4.1 11.9 4.1 8.710 8.104 7.874 13.201 11.706 12.534 11.111 10.336 LSPM J1259+3558 194.9195164 35.9707747 12.79 2.89 133 1 43.4 4.2 1.1 -155.4 3.4 80.1 3.2 10.170 9.556 9.283 16.055 14.506 15.146 13.841 12.352 LTT04030 164.6426792 -5.9034519 11.69 1.09 41 1 43.6 11.7 1.3 44.7 11.5 -269.7 11.1 9.196 8.595 8.330 14.739 13.223 13.960 12.641 11.273 UPM 1031-0024A 157.7897331 -0.4122495 12.78 1.15 25 0 43.3 18.4 1.0 -177.8 23.0 -144.7 22.8 10.561 10.048 9.747 15.597 14.177 14.886 13.540 12.430

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

LSPM J0948+0532 147.0736503 5.5358939 12.55 1.97 50 0 43.3 6.8 1.0 -73.0 6.8 -187.1 6.7 10.047 9.481 9.257 15.810 14.268 14.947 13.662 12.130 G 227-043 280.1488464 59.5147417 10.79 3.07 103 1 43.3 4.4 1.1 153.1 2.9 267.5 2.9 8.777 8.137 7.917 13.701 12.112 12.908 11.531 10.399 LHS 3056 229.7960231 -12.7525478 11.19 2.08 20 0 43.2 16.9 1.0 -703.1 8.8 -193.8 8.8 8.507 7.862 7.582 14.398 12.876 13.571 12.317 10.751 LHS 5177 162.2314194 22.8903383 12.52 2.23 88 0 43.3 8.5 1.1 -486.4 5.1 81.7 4.8 10.016 9.472 9.202 15.970 14.237 15.004 13.601 12.126 G 52-23 129.9492883 8.9390719 11.61 2.35 55 0 43.0 6.3 0.8 -214.3 5.3 185.9 4.9 9.470 8.912 8.648 14.588 12.936 13.932 12.363 11.609 G 5-12 46.3783672 11.8253189 11.55 2.14 53 2 43.3 7.4 1.2 184.1 5.9 -327.3 5.7 9.332 8.713 8.515 14.477 13.005 13.676 12.414 11.250 LP 340-547 315.3185078 33.2419022 10.82 2.06 41 2 43.4 5.7 1.3 294.1 6.2 -115.9 5.3 8.439 7.928 7.635 · · · · · · · · · · · · · · · G 255-55 218.0086647 73.8232147 10.12 3.09 136 0 42.9 5.9 0.8 -183.0 3.9 -117.1 3.9 8.139 7.507 7.295 13.153 11.440 12.442 10.930 9.902 G 75-16 37.0724597 1.4415717 11.52 0.98 37 0 43.0 10.9 1.0 258.9 18.5 -115.0 18.1 9.281 8.671 8.397 14.621 12.950 13.803 12.363 11.099 LSPM J1802+8314 270.5570694 83.2342397 13.60 3.04 172 4 42.9 4.8 0.9 -83.1 3.7 182.0 3.7 10.597 10.009 9.728 · · · · · · · · · · · · · · · 2MASS J13085562+4904495 197.2311511 49.0806433 9.82 2.37 86 0 43.1 5.1 1.1 -101.7 4.7 56.9 4.8 7.897 7.301 7.090 12.595 11.000 11.852 10.365 9.564 LP 404-81 4.4954083 20.9552897 9.99 2.05 23 0 42.9 16.0 1.0 -261.5 10.0 -366.6 9.9 8.250 7.596 7.413 12.234 10.837 11.593 10.230 9.501 LP 340-548 315.3373675 33.2405672 11.38 2.06 41 1 43.2 5.5 1.3 292.5 5.5 -123.2 5.3 8.936 8.360 8.079 · · · · · · · · · · · · · · · G 23-2 292.2724678 7.1608800 9.63 1.94 33 0 44.0 11.8 2.1 252.7 9.9 241.7 9.9 8.022 7.367 7.189 12.011 10.489 11.384 9.934 9.366 LHS 2588 189.1715803 54.9069031 12.90 3.07 143 0 42.9 3.3 1.0 -499.1 2.6 -143.6 2.6 10.388 9.854 9.593 16.321 14.614 15.382 14.005 12.648 2MASS J12322631+2023274 188.1098572 20.3911033 11.44 2.86 114 2 43.2 5.6 1.3 47.2 3.6 23.1 3.2 9.092 8.466 8.213 14.601 13.009 13.714 12.390 11.065 G 36-14 35.8159150 29.2233208 13.93 2.35 58 0 42.8 5.7 1.0 -156.6 3.8 -322.8 3.8 11.068 10.451 10.158 · · · · · · · · · · · · · · · G 67-21 341.9137900 18.4444572 11.49 2.18 50 0 42.8 10.0 1.0 380.7 4.7 192.6 4.7 9.102 8.531 8.273 14.590 13.082 13.778 12.482 11.216 G 120-33 169.7078883 29.2825947 12.24 2.94 97 0 43.4 5.2 1.6 -207.5 3.6 -299.5 3.6 9.866 9.311 9.113 15.242 13.744 14.437 13.201 11.886 2MASS J11421309-0122073 175.5539317 -1.3651390 11.11 1.96 60 1 42.7 10.0 1.0 -106.1 8.9 -9.0 7.4 8.778 8.274 7.968 14.176 12.607 13.367 12.023 10.787 LP 484-5 120.2407858 13.0157050 11.39 2.29 60 0 42.7 5.6 1.0 -211.6 5.5 -88.8 5.2 9.216 8.617 8.355 14.344 12.829 13.517 12.208 11.037 LSPM J1507+1403 226.9295539 14.0630006 11.89 3.03 126 2 42.6 4.6 1.0 75.5 2.9 -137.5 2.6 9.561 9.002 8.748 15.008 13.358 14.148 12.718 11.443 Wolf 1412 272.5974067 51.2652014 11.30 3.02 89 0 42.5 5.4 1.0 52.7 3.9 155.5 3.9 8.996 8.452 8.238 13.864 12.329 13.043 11.691 10.754 G 148-43 184.7733389 31.8454344 10.73 3.04 87 0 42.8 5.8 1.3 -320.7 4.1 13.1 3.6 8.289 7.654 7.400 13.843 12.322 13.026 11.732 10.342 LHS 2191 146.9946353 60.2559964 11.31 2.38 110 3 42.3 4.8 0.8 -861.6 5.2 -211.6 5.2 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J0158+4844 29.5580781 48.7386406 11.22 2.34 108 0 42.5 4.0 1.1 212.1 3.5 -43.3 3.5 9.123 8.431 8.225 14.046 12.563 13.310 11.975 10.924 Wolf 89 27.6178994 18.2959261 9.74 2.16 25 0 42.4 16.1 1.0 240.9 9.0 -83.2 8.5 8.064 7.424 7.240 12.120 10.756 11.491 10.150 9.513 G 161-32 142.1734108 -12.1670394 11.08 1.22 19 0 42.4 14.7 1.0 4.3 18.9 -387.4 18.5 8.837 8.201 7.954 13.688 12.262 12.947 11.668 10.598 RX J2155.3 328.8523617 59.6437411 11.73 2.33 94 2 43.2 5.0 1.9 115.5 3.5 25.0 3.1 9.178 8.597 8.351 15.135 13.534 14.240 12.892 11.359 G 184-22 281.0710119 22.1573069 10.18 3.04 85 0 42.6 5.5 1.3 262.4 3.1 190.8 2.9 10.034 9.511 9.234 · · · · · · · · · · · · · · · b 2MASS J15480280+0421393 237.0115822 4.3606925 11.36 3.03 82 0 42.2 7.4 0.9 -16.2 4.0 -58.6 3.7 9.058 8.432 8.170 14.305 12.834 13.534 12.233 11.010 LP 301-44 58.7135381 29.9591722 15.79 2.35 18 0 42.6 15.5 1.5 169.3 6.9 -79.3 6.8 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J17520294+5636278 268.0119422 56.6079954 11.69 2.93 97 0 42.0 5.8 0.9 -49.4 3.5 52.1 3.5 9.229 8.623 8.380 14.882 13.317 14.043 12.713 11.316 LSPM J0430+3601 67.5767469 36.0260489 11.29 2.37 88 0 44.3 5.4 3.3 196.9 5.0 -28.9 5.0 9.285 8.674 8.432 14.167 12.614 13.417 12.009 10.963 LP 299-52 48.2572347 32.9013008 12.35 2.35 78 0 42.3 3.8 1.3 140.7 3.4 -177.0 3.3 9.854 9.274 9.027 15.785 14.062 15.321 · · · · · · LSPM J0306+1205 46.5635186 12.0984753 14.29 2.10 32 0 42.3 9.7 1.3 229.6 6.1 -10.8 6.0 11.288 10.683 10.425 · · · · · · · · · · · · · · · GJ 4099 287.3292669 39.2003650 9.90 2.94 55 1 42.0 7.8 1.0 -116.0 4.8 -175.0 4.7 7.967 7.391 7.163 13.534 11.561 · · · · · · · · · LSPM J1703+3211 255.9709672 32.1964225 10.43 3.04 109 1 42.1 5.9 1.1 186.2 3.0 105.9 3.0 7.886 7.299 7.079 13.570 11.887 12.665 11.281 9.906 G 230-39 306.3646383 54.5604272 12.59 2.95 159 1 42.1 2.9 1.2 163.6 2.5 339.9 2.5 10.312 9.743 9.489 15.970 14.159 15.052 13.545 12.292 2MASS J19465050-0157397 296.7109075 -1.9610911 10.75 1.27 18 0 42.6 18.7 1.7 107.2 21.3 -30.6 15.1 8.512 7.999 7.749 13.558 12.126 12.817 11.533 10.289 LSPM J1727+2329 261.9696422 23.4953600 12.11 3.06 107 1 42.0 7.0 1.1 -96.0 3.2 -190.9 3.1 9.753 9.127 8.917 15.162 13.714 14.375 13.163 11.731 LP 656-009 71.6012153 -2.8194936 10.65 1.41 52 0 41.8 8.1 1.0 -118.6 12.8 -140.2 12.6 8.676 8.088 7.861 13.393 11.897 12.665 11.287 10.392 LSPM J0313+6521 48.4077792 65.3552978 10.71 2.34 100 0 43.1 4.4 2.3 -89.9 4.1 170.5 4.1 8.728 8.207 7.967 13.495 11.927 12.776 11.294 10.421 G 246-26 47.6112531 58.4349575 10.35 2.31 81 0 43.1 5.9 2.3 110.3 5.5 -201.9 5.5 8.332 7.742 7.503 13.138 11.595 12.402 11.038 10.037 LSPM J0016+3000 4.1695317 30.0167328 11.26 2.25 59 1 41.9 8.1 1.1 216.8 5.6 17.5 5.4 9.110 8.469 8.216 14.150 12.658 13.398 12.057 10.991 LSPM J1921+4230 290.3840436 42.5151383 10.87 3.05 79 3 42.1 4.7 1.3 39.2 3.5 167.1 3.5 8.624 8.000 7.761 13.575 12.206 12.784 11.578 10.500 LSPM J1704+2135 256.0105256 21.5850317 12.48 3.06 100 2 41.8 6.1 1.0 -14.4 2.5 176.9 2.4 10.216 9.580 9.347 15.470 13.955 14.686 13.358 12.121 LP 40-109 200.9839331 69.4510750 10.24 3.10 167 5 41.6 4.3 0.8 54.6 3.2 -169.0 3.2 8.426 7.784 7.614 12.555 11.029 11.947 10.498 9.785 LP 433-61 177.4038369 17.2612703 11.91 2.88 75 0 42.1 8.7 1.3 -303.1 4.9 -45.3 4.5 9.631 9.061 8.786 14.945 13.427 14.138 12.818 11.657 LP 657-4 77.3391944 -8.6490544 12.58 1.25 32 0 41.7 9.2 1.0 397.3 16.6 -53.8 16.5 9.928 9.369 9.062 16.005 14.412 15.108 13.787 12.200 LTT 16939 353.7663131 25.2500961 11.43 2.20 58 1 41.7 8.9 1.0 45.9 5.2 202.7 5.0 9.138 8.599 8.344 14.593 12.946 13.737 12.346 11.063 UPM 2009-0041 302.4696842 -0.6931812 15.00 1.29 13 0 41.9 20.7 1.2 93.3 22.4 -154.4 13.2 12.277 11.749 11.497 · · · · · · · · · · · · · · · G 164-36 194.7670725 31.9878225 12.42 2.90 137 4 41.9 5.3 1.1 -253.5 3.5 142.8 3.5 9.999 9.361 9.147 15.680 14.020 14.767 13.452 12.030 LSPM J0641+2111 100.3880572 21.1839450 11.64 2.30 71 1 41.7 5.5 1.0 -30.2 4.2 -156.6 4.2 9.463 8.886 8.632 14.646 13.077 13.880 12.462 11.293 LHS 5362 314.5979647 42.5859003 11.79 2.28 71 1 42.7 4.2 2.2 304.0 4.1 422.4 3.9 9.490 8.916 8.626 14.715 13.312 13.933 12.969 11.359 LTT05831 220.3983442 -9.7775994 11.18 2.08 35 0 41.4 13.2 1.0 -201.1 8.3 -24.1 8.5 8.674 8.054 7.824 13.963 12.407 13.172 11.889 10.589 LSPM J2330+0002 352.6951078 0.0333981 12.39 2.06 42 0 41.4 10.4 1.1 62.1 7.1 -169.2 5.8 10.040 9.434 9.191 15.466 14.044 14.702 13.477 12.101 PM I18133+0751 273.3345722 7.8650734 11.70 3.03 61 0 42.3 12.9 2.0 13.9 4.8 59.0 4.7 9.359 8.757 8.506 14.979 13.279 14.043 12.688 11.372 UPM 1731-0239 262.7800431 -2.6551439 13.19 2.13 39 0 42.2 10.1 1.9 -47.7 4.8 -29.1 5.0 10.315 9.705 9.420 16.519 15.007 15.634 14.298 12.772 2MASS J15442922+4910284 236.1216506 49.1746428 12.79 3.07 109 0 41.3 4.4 1.0 -15.6 2.7 24.6 2.6 10.153 9.535 9.189 16.353 14.627 15.394 14.008 12.453 G 198-71A 190.4091211 48.2396219 10.39 3.08 89 2 41.5 4.3 1.3 224.3 3.7 -155.8 3.7 8.376 7.797 7.565 13.120 11.728 12.351 11.125 10.215 G 45-23 164.5228472 6.5629803 13.25 1.91 49 0 41.3 8.2 1.1 -304.8 6.2 -50.7 5.5 10.598 10.087 9.759 15.859 14.208 15.157 13.596 12.184 SCR 1005-0228 151.4228675 -2.4803000 13.68 1.13 25 0 41.3 17.9 1.1 -203.3 33.1 49.9 32.6 11.151 10.581 10.260 16.882 15.404 16.096 14.811 13.320 PM I21055+0609N 316.3836492 6.1544725 11.06 1.96 39 0 41.0 7.0 0.9 19.7 6.0 46.4 6.0 8.694 8.044 7.802 14.118 12.599 13.317 12.035 10.678

Table 3—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

PM I17411+1504 265.2847728 15.0754744 12.06 3.03 97 3 41.1 8.1 1.0 -43.9 3.8 -66.1 3.8 9.533 8.958 8.694 15.194 13.665 14.375 13.074 11.647 LSPM J1906+0354 286.6374389 3.9030714 11.92 3.03 43 0 42.7 8.3 2.7 192.4 6.7 56.6 5.1 9.503 8.904 8.656 15.152 13.513 14.263 12.857 11.476 LSPM J1657+2448 254.3719908 24.8157064 16.01 2.85 16 0 40.9 18.3 0.9 72.0 8.1 396.0 8.1 · · · · · · · · · · · · · · · · · · · · · · · · TYC 3048-1293-1 227.0952119 41.5405211 10.47 3.03 91 0 41.0 5.3 1.0 -71.0 4.2 0.2 3.9 8.337 7.703 7.502 13.388 11.757 12.618 11.149 10.140 LTT05425 208.8972356 -7.3884707 11.08 2.09 40 0 41.1 14.0 1.1 251.2 7.2 -101.1 7.2 8.813 8.233 7.947 14.131 12.613 13.297 12.003 10.817 G 6-36 56.9778644 16.7573017 11.14 2.22 64 3 41.3 6.3 1.4 276.9 5.5 174.3 5.5 9.231 8.684 8.437 13.866 12.333 13.106 11.719 10.920 LHS 2363 167.7127889 47.9485386 12.71 3.04 129 2 41.1 3.0 1.2 -294.9 2.4 -522.8 2.4 10.082 9.533 9.271 15.969 14.493 15.069 13.911 12.316 UPM 0402-0242B 60.6351381 -2.7094567 10.82 2.11 35 0 40.9 11.0 1.1 41.2 9.3 -27.6 9.2 8.451 7.830 7.552 14.022 12.458 13.180 11.885 10.516 SCR 1921-0448 290.2645819 -4.8122311 13.76 1.27 22 0 42.3 14.7 2.5 190.6 15.4 8.8 9.6 11.278 10.732 10.478 16.938 15.183 15.959 14.556 13.214 LSPM J1020+4917 155.1546861 49.2952647 11.68 2.33 146 2 40.9 3.8 1.1 -373.8 3.9 -144.5 3.9 9.396 8.771 8.579 14.771 13.178 13.932 12.600 11.299 SCR 0436-1237 69.2181253 -12.6299503 12.08 1.25 11 0 40.7 18.2 1.0 -92.5 27.9 -168.3 28.5 10.298 9.711 9.609 13.717 12.580 13.155 12.063 11.672 G 224-65 230.9625925 58.4699242 12.51 3.05 141 3 40.6 3.9 0.9 -185.8 2.7 298.1 2.8 9.905 9.342 9.075 16.193 14.345 15.171 13.678 12.139 LP 41-203 217.8631681 72.7552678 11.76 3.09 218 2 40.5 3.2 0.8 -264.3 2.3 -102.1 2.3 9.507 8.939 8.689 14.903 13.327 14.143 12.796 11.466 Ross 448 171.1933581 67.5525100 10.57 3.03 131 2 40.7 4.4 1.0 316.9 3.5 -232.6 3.5 8.659 8.088 7.821 13.291 11.802 12.506 11.173 10.250 LP 045-128 285.6285203 70.4314128 11.27 3.07 164 1 40.6 4.6 1.1 1.7 3.0 212.8 3.0 8.958 8.391 8.124 14.067 12.587 13.282 12.014 10.789 G 202-64 248.9668014 48.3997656 12.60 3.07 159 4 40.6 3.6 1.0 -177.2 2.0 -296.1 2.1 10.170 9.564 9.299 15.814 14.227 14.927 13.634 12.244 G 256-30 241.3616272 76.9161733 10.85 3.08 190 3 40.4 5.4 0.8 -341.2 3.4 73.9 3.3 8.632 7.990 7.736 14.009 12.218 13.378 11.847 10.676 LP 585-30 6.8434233 1.0740458 11.69 1.87 38 0 40.4 12.3 0.9 194.5 13.4 2.9 12.7 9.519 8.979 8.692 14.864 13.208 13.985 12.599 11.364 LSPM J1758+3157 269.5005397 31.9581269 13.59 2.29 27 0 40.5 10.6 1.1 -66.9 7.2 132.1 7.3 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J1321+0332 200.3755906 3.5504753 10.80 2.95 59 1 40.7 11.6 1.2 86.9 7.1 176.7 6.2 8.877 8.309 8.045 13.495 12.006 12.731 11.469 10.609 G 30-26 357.9366297 6.9700017 11.18 2.23 57 3 40.4 8.9 0.9 -54.5 5.0 -296.0 4.5 8.841 8.700 8.188 14.236 12.696 13.470 12.039 10.720 LP 701-056 345.4432089 -6.2400419 11.77 1.97 33 0 40.3 11.5 0.9 184.9 9.0 -68.5 7.7 9.486 8.901 8.648 14.978 13.138 14.098 12.512 11.278 SCR 0201-0806 30.4055167 -8.1170467 13.56 1.17 19 0 40.5 9.9 1.1 73.8 23.0 -121.5 23.2 11.267 10.746 10.519 16.563 14.991 15.802 14.436 13.246 G 151-37 228.9315317 -7.4236475 11.28 2.11 70 0 40.5 9.1 1.1 -141.0 6.9 -255.4 6.8 8.566 8.015 7.706 14.531 12.924 13.636 12.332 10.779 2MASS J10494146+2538535 162.4220583 25.6477156 15.85 2.07 20 0 40.5 19.2 1.1 -136.3 10.7 -132.8 10.4 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J05533463+1520075 88.3947878 15.3358867 11.69 2.29 67 2 40.5 5.0 1.2 115.7 3.8 105.1 3.8 9.357 8.788 8.552 14.881 13.280 13.991 12.613 11.369 G 183-10 268.2515822 16.9166500 11.19 3.03 65 0 40.7 7.4 1.4 -264.0 5.2 -222.1 5.2 8.699 8.158 7.874 14.318 12.771 13.469 12.154 10.763 LP 74-35 313.7286831 67.5860683 10.80 3.01 99 0 41.0 5.0 1.8 163.7 3.9 116.4 3.8 8.749 8.170 7.910 13.542 12.115 12.812 11.489 10.461 GJ 3152A 35.1070111 37.7915561 11.17 2.34 82 0 40.3 3.7 1.2 338.5 3.5 -72.1 3.5 8.952 8.327 8.114 14.244 12.691 13.434 12.105 10.896 LSPM J1829+6351 277.3054497 63.8530706 10.60 3.02 103 1 40.0 5.1 0.9 191.7 3.4 2.3 3.5 8.721 8.195 7.956 13.687 11.862 12.906 11.364 10.365 LSPM J0836+2628 129.1103397 26.4718822 11.05 2.37 71 1 40.0 4.1 1.0 -188.3 4.2 -35.4 4.2 8.964 8.281 8.074 13.971 12.448 13.183 11.839 10.740 Ross 24 59.6535375 52.0228228 10.86 2.38 113 2 40.5 4.0 1.6 370.5 3.5 -214.0 3.4 8.922 8.243 8.070 13.675 12.104 12.901 11.512 10.584 LSPM J1907+5905 286.8539697 59.0865939 10.80 3.06 92 1 40.0 4.7 1.2 76.0 3.1 164.4 3.2 8.457 7.820 7.565 · · · · · · · · · · · · · · · LHS 3246 252.7213828 -4.8441092 11.88 2.12 55 3 40.0 9.7 1.6 -753.6 4.2 -242.1 4.2 9.465 8.923 8.676 · · · · · · · · · · · · · · ·

a arge correction so cut off of 3.9 mas used to convert from relative to absolute parallax

b no correction so mean of 1.3 mas used to convert from relative to absolute parallax

Table 4 New Nearby Star discoveries

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

UPM0429+3806 67.3570786 +38.1026178 15.36 2.35 39 3 227.2 19.0 2.8 114.7 14.0 3.8 13.0 13.636 13.204 13.152 16.568 15.455 16.044 15.216 14.717 a b UPM2340+4625 355.0318225 +46.4188983 14.93 2.21 47 1 206.5 17.3 0.9 48.5 12.3 42.0 12.0 13.658 13.232 13.137 · · · · · · · · · · · · · · · a b UPM2340+4631 355.0836800 +46.5196811 15.61 2.21 33 0 177.9 24.1 0.9 18.6 16.2 31.0 16.2 14.110 13.611 13.492 · · · · · · · · · · · · · · · a b UPM0416+3100 64.1374097 +31.0006092 14.50 2.35 52 0 176.3 17.9 1.3 43.2 10.9 -8.7 9.9 13.086 12.645 12.605 15.722 14.728 15.189 14.382 14.014 a b UPM0012+5215 3.1964658 +52.2626775 15.62 2.21 34 1 154.3 17.3 1.1 42.6 14.5 46.2 14.0 14.374 14.049 14.075 · · · · · · · · · · · · · · · b TYC 3576-1996-1 303.7610778 +47.8085700 10.91 2.01 45 8 142.3 18.7 1.4 -77.0 18.5 11.4 15.3 6.274 5.373 5.114 11.958 9.902 · · · · · · · · · a b UPM1945+2836 296.3512033 +28.6154467 13.74 2.28 49 12 140.9 10.7 1.9 340.6 14.8 76.7 8.4 7.404 6.116 5.444 15.243 14.733 14.824 14.316 · · · UPM0429+3001 67.3685742 +30.0322825 15.34 2.35 31 1 135.4 24.5 1.6 -7.8 13.1 -7.7 12.1 13.058 12.467 12.312 · · · · · · · · · · · · · · · a b UPM0011+5231 2.9209547 +52.5282375 14.25 2.21 63 2 133.4 10.9 1.2 20.6 7.6 14.0 7.5 13.264 12.903 12.875 · · · · · · · · · · · · · · · a b UPM0001+5425 0.3554147 +54.4210864 15.85 2.20 33 1 132.7 15.1 1.2 46.8 13.9 21.8 13.3 14.374 14.051 13.979 16.454 15.885 16.255 15.488 · · · a b UPM0013+7812 3.3328747 +78.2006672 15.67 2.26 32 1 126.6 21.0 1.1 -19.2 14.6 4.4 14.1 13.885 13.501 13.529 16.900 15.839 16.346 15.381 · · · a b UPM0018+4934 4.6475475 +49.5783914 14.01 2.20 56 0 125.4 10.9 1.0 -22.5 9.2 -5.7 8.8 12.890 12.561 12.466 14.889 14.106 14.486 13.866 13.683 a b UPM2354+4741 358.5021769 +47.6942836 15.43 2.21 40 0 124.5 15.9 1.0 28.9 13.0 22.7 13.0 14.025 13.525 13.435 16.323 15.418 15.851 15.196 14.753 b UPM0004+5442 1.2133850 +54.7036306 15.51 2.20 32 0 121.3 16.2 1.3 39.8 13.6 54.0 14.0 14.220 13.970 13.833 · · · · · · · · · · · · · · · b 2MASS J13282349+3545248 202.0973419 +35.7567269 13.61 2.87 31 0 112.3 24.1 1.5 -259.6 16.3 22.9 14.2 10.970 10.401 10.114 · · · · · · · · · · · · · · · a b UPM2140+4234 325.0941069 +42.5723067 13.10 2.32 81 0 111.8 10.8 1.3 96.3 7.7 2.5 7.4 11.752 11.153 10.902 14.627 13.540 14.104 13.112 12.664 a b UPM1758-0057 269.5545683 -00.9595833 13.02 3.05 38 1 110.6 18.9 2.2 8.3 5.3 -7.0 5.0 11.257 10.794 10.672 14.340 13.332 13.799 12.967 12.558 a UPM1758-0055 269.5749217 -00.9242994 13.48 3.05 34 0 109.5 23.3 2.2 2.8 6.6 2.1 6.2 11.732 11.385 11.333 · · · · · · · · · · · · · · · a UPM1214-0145 183.7027389 -01.7637781 13.28 1.99 31 0 104.1 17.8 1.1 -54.1 10.9 -19.7 8.5 11.984 11.652 11.580 13.646 12.921 13.221 12.750 12.581 a b UPM1758-0104 269.5661319 -01.0791914 13.29 3.05 34 0 103.5 22.0 2.2 -5.3 6.1 -5.1 5.7 11.056 10.387 10.237 15.226 13.855 14.534 13.333 12.740 a UPM1758-0058 269.5463481 -00.9720556 12.91 3.05 41 0 103.2 18.4 2.2 4.1 5.1 -0.8 4.8 10.840 10.231 10.057 14.876 13.486 14.152 13.009 12.462 a UPM0034+5433 8.7426169 +54.5536103 14.23 2.21 72 0 102.7 14.1 1.3 37.6 11.6 46.7 11.7 13.138 12.871 12.805 15.137 14.367 14.726 14.126 13.949 a b UPM0038+5142 9.6386553 +51.7136919 14.74 2.21 32 2 101.9 19.5 1.1 10.4 14.9 3.1 14.9 13.419 13.055 13.069 15.373 14.629 14.925 14.406 14.220 b 2MASS J20000565+3057300 300.0254483 +30.9639133 14.34 2.25 56 0 101.2 6.2 1.7 383.2 5.5 1289.6 5.4 · · · · · · · · · · · · · · · · · · · · · · · · UPM1916+8413 289.1018475 +84.2286261 13.03 3.04 179 2 88.3 4.3 0.9 -57.3 4.4 149.3 4.4 9.977 9.380 9.058 · · · · · · · · · · · · · · · UCAC3 203-28522 84.1602314 +11.2966211 11.08 2.18 42 1 88.1 6.1 1.0 1.4 5.6 -53.0 5.6 8.266 7.691 7.406 14.146 12.577 13.281 11.905 10.427 LHS 1631 62.0564069 +74.3813644 11.75 2.39 118 3 76.9 5.6 0.8 678.0 4.7 -600.7 4.9 · · · · · · · · · 14.867 13.212 14.042 12.649 11.225 UPM0108+1358 17.0636125 +13.9682581 11.84 2.07 70 1 76.5 12.1 0.9 -8.9 6.7 -15.6 6.3 10.833 10.545 10.456 12.552 11.970 12.205 11.753 11.623 a UPM0534+3937 83.7193367 +39.6193806 10.52 2.29 64 0 76.3 10.8 1.3 -26.1 9.2 13.3 8.2 5.360 4.159 3.684 13.044 11.352 12.205 10.497 8.835 a 2MASS J02132062+3648506 33.3361011 +36.8142878 12.31 2.34 130 3 74.6 3.5 1.0 43.1 3.3 43.8 3.2 9.367 8.825 8.518 15.879 14.128 14.894 13.480 11.779 2MASS J04060688-0534444 61.5287264 -05.5796364 11.84 2.08 46 0 74.4 6.6 1.1 17.4 5.5 -133.3 5.4 9.128 8.554 8.304 14.985 13.313 14.069 12.716 11.227 UPM0505+4414 76.2751814 +44.2342619 12.79 2.29 125 0 72.3 3.5 1.7 94.4 2.8 -28.6 2.8 9.829 9.264 9.017 · · · · · · · · · · · · · · · UPM1006+1819 151.6580356 +18.3311956 12.45 2.24 91 2 72.0 9.1 0.8 -12.4 5.1 -15.8 4.9 11.118 10.680 10.656 13.573 12.745 13.154 12.446 12.542 a G 140-42 272.3156311 +11.0384981 13.61 3.03 48 0 70.4 7.3 1.4 -159.6 4.3 -368.0 4.0 · · · · · · · · · · · · · · · · · · · · · · · · UPM0140+3800 25.2490356 +38.0127714 13.04 2.31 76 5 69.0 10.4 1.2 5.2 7.6 -15.8 7.6 11.847 11.488 11.488 13.912 13.201 13.465 12.972 12.751 GSC 00276-00908 178.0411175 +03.9560436 11.07 2.94 67 0 67.7 8.8 1.2 60.5 5.8 -121.2 5.2 8.382 7.827 7.529 14.259 12.616 13.368 11.996 10.500 2MASS J05102677+2552475 77.6104144 +25.8811731 14.37 2.21 36 0 66.2 5.8 2.1 -229.7 5.1 270.5 4.8 16.375 15.683 15.817 · · · · · · · · · · · · · · · 2MASS J09430114+2349173 145.7547769 +23.8218661 11.09 2.32 61 0 65.9 7.1 0.9 -159.5 5.3 -220.6 5.2 13.004 12.390 11.966 · · · · · · · · · · · · · · · UPM1424+3640 216.0927281 +36.6750194 13.19 2.90 99 1 65.8 4.3 1.3 114.1 2.9 -63.5 2.7 10.428 9.881 9.589 16.601 14.821 15.590 14.248 12.642 2MASS J00062445+5942444 1.6009994 +59.7117369 14.74 2.34 47 0 65.5 6.1 1.5 -107.8 4.9 -149.8 4.6 11.460 10.917 10.607 · · · · · · · · · · · · · · · 2MASS J05214793+1720341 80.4496211 +17.3434244 13.04 2.20 57 0 65.2 5.8 1.1 -15.5 5.3 129.9 5.1 10.147 9.636 9.316 16.488 14.642 15.476 14.005 12.395 2MASS J01330985+6958071 23.2910183 +69.9689189 11.45 2.35 102 1 64.7 4.6 2.3 3.8 3.9 76.2 3.8 9.075 8.506 8.288 14.308 12.733 13.600 12.209 10.978 TYC 867-83-1 178.4564692 +11.4499647 12.09 2.94 92 1 63.7 8.5 1.2 -55.1 4.8 -38.4 4.2 11.027 10.637 10.619 12.932 12.270 12.537 12.129 11.962 a UPM2001+6953 300.3332950 +69.8922769 14.51 3.06 83 0 63.5 5.4 1.1 40.0 3.7 15.3 3.4 11.137 10.512 10.203 · · · · · · · · · · · · · · · 2MASS J23545647+5036148 358.7356453 +50.6041686 11.21 2.20 104 5 63.4 5.6 1.2 50.4 4.6 13.5 4.7 8.798 8.211 7.954 · · · · · · · · · · · · · · · UPM0528+1120 82.2005072 +11.3483842 13.20 2.19 45 0 63.3 7.1 1.3 -88.0 6.9 -65.4 6.7 10.174 9.662 9.331 16.501 14.799 15.547 14.159 12.537 UPM1227+0741 186.8191264 +07.6955486 13.36 3.04 68 1 62.4 11.0 1.2 -54.1 6.2 9.2 4.6 12.158 11.790 11.615 14.055 13.434 13.669 13.263 13.138 a 2MASS J21491738+5922511 327.3230483 +59.3812236 12.21 2.33 109 3 62.1 3.8 1.9 91.5 3.0 79.4 3.0 9.723 9.108 8.852 15.307 13.691 14.461 13.079 11.704 2MASS J19192785+1438019 289.8681106 +14.6336267 14.43 2.94 31 0 62.1 6.9 2.8 511.0 6.3 -56.4 5.6 13.836 14.887 14.319 · · · · · · · · · · · · · · · TYC 981-582-1 258.0141575 +10.7595869 11.47 3.03 64 2 61.9 13.9 1.0 27.0 6.0 23.7 6.4 10.355 10.064 10.037 12.021 11.450 11.636 11.342 11.235 a UPM1858+8739 B 284.7069472 +87.6604789 14.92 2.04 43 1 61.8 6.1 1.0 32.7 8.3 147.3 8.2 12.000 11.467 11.167 17.622 16.549 17.031 15.730 14.140 1RXS J195446.2+842937 298.6980808 +84.4920611 12.27 2.07 212 2 61.7 3.2 0.9 21.8 3.3 131.9 3.3 9.514 8.922 8.659 15.497 13.919 14.673 13.321 11.808 LHS 1705 72.7130433 +26.1229567 11.51 2.31 66 0 61.5 6.8 3.1 584.7 5.4 -246.8 5.3 · · · · · · · · · 14.408 12.835 13.560 12.222 11.003 2MASS J04542406+3830436 73.6021006 +38.5110686 14.26 2.28 72 1 60.9 5.1 1.8 336.2 4.4 -247.0 4.3 · · · · · · · · · · · · · · · · · · · · · · · · Wolf 346 152.1764042 +35.5475092 11.39 2.32 111 4 60.7 3.7 1.0 198.0 3.6 130.0 3.7 9.167 8.618 8.319 14.390 12.728 13.546 12.130 10.970 UPM2205+3550 331.4964694 +35.8492628 14.16 2.14 53 0 60.4 6.4 0.9 84.4 4.0 -57.5 4.0 11.139 10.570 10.256 17.608 15.926 16.666 15.208 13.407 UPM1808+0557 272.1856692 +05.9652983 11.94 3.03 65 1 60.4 14.5 1.2 1.8 5.0 2.2 5.0 7.797 6.795 6.475 16.175 14.422 15.229 13.515 11.157 a UPM0255+5707 43.9408208 +57.1298989 15.06 2.35 65 0 59.8 7.1 2.2 57.9 5.1 28.0 5.1 11.336 10.717 10.364 · · · · · · · · · · · · · · · a UPM0424+2142 66.1112222 +21.7089892 15.25 2.31 39 0 59.5 7.9 1.6 28.8 5.6 -103.9 5.3 11.752 11.206 10.888 · · · · · · · · · · · · · · · a UPM1210+1244 182.5183917 +12.7359731 13.28 2.88 77 1 59.4 8.6 1.2 -32.8 4.7 -34.9 3.5 10.311 9.757 9.449 16.766 15.033 15.812 14.363 12.669 UPM0255+7928 43.9610572 +79.4724697 14.61 2.24 64 0 59.2 5.4 1.1 -6.9 5.7 -99.0 5.7 11.503 10.929 10.603 18.376 16.397 17.179 15.753 13.861 LHS 5326 259.1428531 +87.2261267 13.72 3.03 101 2 58.9 6.6 1.0 -369.9 4.6 309.6 4.5 · · · · · · · · · 16.957 15.441 16.201 14.726 13.208 UPM1858+8739 A 284.6064231 +87.6656714 13.74 3.01 68 1 58.4 5.9 1.0 32.8 7.3 147.8 7.4 11.061 10.530 10.240 16.735 15.232 15.969 14.585 13.122 2MASS J07350593+1000283 113.7736619 +10.0087011 14.56 2.21 31 0 58.4 7.3 1.1 -254.0 6.7 208.8 6.4 · · · · · · · · · 18.269 16.109 16.951 15.527 13.903

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

2MASS J18251798+1839091 276.3244519 +18.6523542 12.16 3.04 85 0 58.3 6.0 1.1 -109.4 3.6 -52.0 3.5 9.574 8.987 8.701 · · · · · · · · · · · · · · · 2MASS J17342277+6333265 263.5965647 +63.5571522 14.07 3.08 87 0 58.0 5.7 0.9 180.3 3.0 -58.8 2.9 11.304 10.764 10.502 17.350 15.787 16.601 15.040 13.488 UPM0005+5449 1.3318894 +54.8167186 13.66 2.20 83 0 57.8 6.0 1.3 7.8 5.1 18.6 5.2 12.189 11.634 11.459 15.077 14.024 14.560 13.689 13.282 UPM0838-0641 129.6724394 -06.6922142 12.01 2.32 49 0 57.8 6.2 0.9 4.3 6.6 -2.4 6.6 9.589 8.983 8.740 14.570 13.040 13.806 12.430 11.396 a UPM1952+8646 298.2010281 +86.7818714 13.50 3.02 104 2 57.7 3.8 0.9 70.9 4.7 54.4 4.7 10.915 10.326 10.091 16.581 14.986 15.776 14.377 12.853 GJ 3861 219.2253581 +58.3458675 10.60 3.08 140 1 57.7 4.2 1.0 620.4 3.2 -707.5 3.1 · · · · · · · · · 13.379 11.769 12.576 11.199 10.031 LHS 2262 156.5085975 +50.4502881 11.89 2.32 169 1 57.5 3.7 1.1 -367.4 4.3 -552.2 4.4 · · · · · · · · · · · · · · · · · · · · · · · · UPM1802+1211 270.6920703 +12.1858444 12.95 3.03 62 0 57.4 10.2 1.2 -22.4 4.5 -107.6 4.4 10.078 9.474 9.229 16.097 14.476 15.230 13.834 12.245 a LP 594-2 59.0055486 -00.6531997 12.00 2.19 61 2 57.4 8.0 1.6 176.7 8.0 43.4 8.1 9.575 8.957 8.686 14.807 13.284 14.012 12.687 11.465 a 2MASS J20221862+3217154 305.5783161 +32.2875269 11.45 2.70 62 0 57.0 5.8 1.9 150.9 5.6 -11.4 5.4 8.810 8.218 7.924 · · · · · · · · · · · · · · · 2MASS J07080064+2233276 107.0023556 +22.5573475 12.41 2.30 71 1 56.7 4.8 0.7 -85.5 4.3 -79.1 4.2 9.682 9.070 8.814 15.543 13.940 14.675 13.302 12.186 UPM1852+1918 283.1929600 +19.3138217 11.86 3.04 84 1 56.4 7.1 1.6 -25.4 3.3 -25.8 3.4 9.468 8.903 8.685 14.645 13.124 13.865 12.530 11.354 a UPM1625+0643 246.4551681 +06.7244147 12.56 3.03 62 1 56.2 6.9 1.0 66.8 3.2 24.5 2.9 10.109 9.541 9.301 15.519 13.789 14.578 13.213 12.053 a LP 292-71 5.4933058 +31.6216417 14.67 2.27 51 0 56.0 7.4 1.0 292.0 4.8 247.5 4.9 · · · · · · · · · · · · · · · · · · · · · · · · UPM0432+6300 68.0751872 +63.0015264 13.38 2.38 106 0 55.8 4.1 2.0 26.7 3.4 -95.7 3.4 10.573 10.034 9.754 17.090 15.236 15.994 14.565 12.831 2MASS J11505233+6831161 177.7183114 +68.5209522 15.42 3.06 48 0 55.6 3.5 1.0 25.4 2.9 -44.0 2.8 14.462 14.220 14.218 15.678 15.227 15.457 15.148 15.062 TYC 990-1995-1 260.3974339 +13.2769781 12.00 3.03 81 1 55.5 10.4 0.9 -26.5 4.8 26.4 4.4 10.745 10.402 10.341 12.919 12.188 12.490 11.984 11.831 UPM2049+3637 312.4865392 +36.6285672 14.87 2.03 45 0 55.4 6.0 1.4 131.2 5.7 -16.0 5.7 11.587 10.983 10.689 · · · · · · · · · · · · · · · 2MASS J01530103+2937044 28.2544044 +29.6168281 11.02 2.30 55 0 55.4 5.3 1.3 4.4 4.5 -226.2 4.6 · · · · · · · · · 13.854 12.351 13.056 11.735 10.474 UPM1109+1328 167.4490481 +13.4681008 13.16 2.05 73 0 55.1 8.3 1.1 -44.6 4.9 1.2 4.5 11.445 10.840 10.695 15.002 13.814 14.427 13.295 12.821 a TYC 385-963-1 254.1253642 +01.1189244 11.07 2.15 63 0 55.0 11.2 1.1 -137.9 6.4 -71.0 6.4 9.675 9.230 9.100 12.287 11.326 11.764 11.018 10.735 G 208-25 291.8254597 +42.5309331 13.40 3.03 76 0 54.9 4.8 1.3 405.3 3.7 -161.2 3.7 · · · · · · · · · 16.910 15.131 15.782 14.485 12.942 UPM0922+3127 140.6228244 +31.4627797 13.29 2.35 71 0 54.9 4.1 1.2 -110.4 4.2 61.5 4.2 10.527 9.965 9.686 16.574 14.969 15.756 14.298 12.704 NLTT 25111 161.2691667 +82.5572839 12.85 3.02 149 0 54.7 4.2 0.7 -265.3 4.3 -65.8 4.3 · · · · · · · · · 16.049 14.426 15.291 13.842 12.643 GJ 3144 34.0673161 +39.8566783 14.95 2.34 55 0 54.7 3.8 1.0 -154.2 2.9 -94.0 2.8 14.304 14.223 14.144 14.798 14.521 14.601 14.594 14.688 UPM0724+1838 111.0717683 +18.6463272 13.57 2.29 64 0 54.7 5.0 1.0 -104.9 4.5 -81.0 4.5 10.591 10.033 9.739 16.957 15.264 15.944 14.629 12.900 UPM2011+3824 302.8572867 +38.4043650 11.47 2.93 67 1 54.6 3.6 1.7 44.0 3.3 116.9 3.3 9.087 8.511 8.283 · · · · · · · · · · · · · · · LHS 1663 65.4982661 +75.1393000 10.81 2.38 112 3 54.5 5.2 0.9 539.7 4.9 -480.5 4.8 · · · · · · · · · 13.530 12.052 12.828 11.530 10.338 G 230-41 307.0774950 +61.7299150 11.77 2.94 72 1 54.5 5.5 1.4 -292.9 4.0 -13.8 4.0 · · · · · · · · · 14.651 13.190 13.794 12.460 11.134 UPM1427+6056 216.7865453 +60.9410856 14.29 3.08 76 0 54.5 4.7 0.9 88.8 3.3 -20.9 3.3 10.987 10.420 10.076 18.367 16.565 17.311 15.869 13.593 LHS 2480 179.3728306 +79.4500381 15.37 3.07 68 1 54.4 6.0 1.0 -875.3 5.6 -153.8 5.1 · · · · · · · · · · · · · · · · · · · · · · · · G 259-5 254.3735906 +77.7183214 11.11 3.08 159 1 54.4 6.0 0.8 202.5 3.0 162.0 3.1 15.047 10.079 9.832 14.134 12.523 13.452 12.124 11.087 LHS 1633 62.1467136 +50.1729936 14.84 2.34 60 0 54.4 5.6 1.6 384.2 5.1 -431.8 4.9 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J14170731+0851363 214.2799681 +08.8602728 12.07 2.14 110 0 54.3 6.3 1.0 -128.3 5.0 29.4 4.6 9.109 8.501 8.198 15.678 13.909 14.647 13.256 11.536 UPM1006+0921 151.5085556 +09.3634856 12.12 2.94 63 0 54.2 9.2 1.1 -76.5 7.9 -20.5 7.6 10.791 10.403 10.322 13.080 12.220 12.632 11.969 11.754 a 2MASS J09022307+1746326 135.5955208 +17.7755456 12.48 1.91 47 0 54.1 6.9 1.2 -126.4 8.0 -51.3 6.9 9.645 9.039 8.784 15.582 13.915 14.672 13.303 11.800 a GSC 04160-00286 179.4585897 +66.5619775 13.17 3.06 112 1 54.0 4.5 0.9 110.1 3.7 -73.5 3.6 10.232 9.674 9.359 16.833 15.084 15.917 14.388 12.589 V* BT UMa 172.7238014 +44.2438144 12.35 3.01 125 1 53.9 3.8 1.8 17.0 3.3 97.9 3.2 9.619 9.070 8.797 · · · · · · · · · · · · · · · UPM1728+3722 262.0987889 +37.3674625 14.21 2.98 69 0 53.8 5.8 1.0 -65.3 3.5 55.7 3.5 11.079 10.487 10.177 17.664 16.046 16.672 15.350 13.503 UPM0053+6916 13.4927111 +69.2803658 13.58 2.35 110 1 53.5 4.4 2.2 -138.9 3.5 74.2 3.4 10.623 10.021 9.753 17.103 15.512 16.159 14.771 12.925 LP 192-32 1.5661114 +44.1745317 14.74 2.21 49 1 53.5 5.8 1.1 273.7 4.1 51.6 4.1 · · · · · · · · · · · · · · · · · · · · · · · · UPM1021+2507 155.3667947 +25.1227708 14.33 2.21 61 0 53.4 9.1 1.1 -10.2 6.8 -69.8 6.7 11.275 10.703 10.428 · · · · · · · · · · · · · · · UPM1425+2540 216.3942075 +25.6680289 14.97 2.85 51 0 53.3 7.9 2.2 -47.5 5.4 -12.9 5.2 11.083 10.464 10.105 · · · · · · · · · · · · · · · UPM0718+0829 109.6744786 +08.4999517 12.48 2.28 42 0 53.1 7.7 1.0 -36.3 6.4 -114.3 5.5 9.859 9.280 9.020 15.555 13.799 14.614 13.208 11.860 UPM0424+3825 66.0773844 +38.4263639 15.33 2.35 46 0 52.9 6.2 3.1 110.4 4.9 -94.8 4.8 12.141 11.554 11.277 · · · · · · · · · · · · · · · NLTT 27416 171.7727714 +02.7507583 12.74 1.94 61 0 52.9 9.2 1.1 314.8 7.3 2.6 5.5 · · · · · · · · · 15.723 14.079 14.862 13.509 12.155 LHS 2659 194.8600686 +56.5625728 11.76 3.08 182 2 52.8 3.2 1.1 -581.5 2.3 -82.3 2.3 · · · · · · · · · 14.636 13.229 13.870 12.630 11.351 G 102-35 87.8865722 +11.8091431 11.85 2.21 82 0 52.8 4.9 1.3 257.0 4.5 -177.3 4.5 · · · · · · · · · 14.544 13.030 13.807 12.459 11.519 UPM0948+7723 147.1249850 +77.3897222 13.34 2.38 101 1 52.6 4.0 1.2 34.3 4.2 106.6 4.1 10.646 10.056 9.798 16.726 14.999 15.772 14.375 12.769 LP 559-43 212.4458717 +06.2129303 11.37 2.13 78 1 52.6 7.6 1.0 -216.1 5.9 -100.0 5.7 9.409 8.795 8.570 13.783 12.344 13.083 11.738 10.974 LHS 1973 120.6878533 +59.0278533 12.16 2.39 147 1 52.5 3.8 1.1 495.8 3.5 -207.6 3.2 · · · · · · · · · 15.273 13.734 14.422 13.128 11.745 UPM2313+1428 348.4697419 +14.4739300 12.69 2.18 65 0 52.3 8.1 1.0 -46.0 3.8 -151.3 3.8 10.061 9.497 9.218 15.574 14.016 14.800 13.430 12.101 UPM0654+1310 103.7034997 +13.1672900 13.66 2.29 45 0 52.3 5.1 1.1 75.8 3.9 -82.6 3.6 10.808 10.261 10.001 16.906 15.110 15.899 14.539 13.006 UPM1859+4324 284.9854572 +43.4014378 13.73 3.06 90 0 52.2 4.0 1.1 520.0 3.3 475.6 3.3 · · · · · · · · · · · · · · · · · · · · · · · · UPM1846+3333 281.5454625 +33.5519169 9.85 3.04 73 1 52.2 5.1 1.3 92.9 3.8 77.6 3.7 10.989 10.378 10.104 · · · · · · · · · · · · · · · c 2MASS J12054715+7825514 181.4422072 +78.4309936 10.83 3.07 188 1 52.1 4.1 1.1 -200.1 3.4 9.4 3.4 · · · · · · · · · 13.661 12.114 12.927 11.537 10.417 G 181-8 251.4330614 +36.0985886 13.08 3.06 102 0 52.1 4.3 0.9 -132.4 2.6 336.1 2.5 · · · · · · · · · 16.170 14.545 15.290 13.831 12.532 UPM1729+4122 262.2673783 +41.3736664 14.55 2.99 61 0 52.0 7.3 0.6 -115.8 4.5 -37.6 4.0 11.166 10.611 10.304 · · · · · · · · · · · · · · · TYC 4532-731-1 80.6658531 +79.5750953 10.22 2.30 69 3 51.9 7.8 1.1 97.4 7.2 -46.1 6.8 8.200 7.583 7.345 12.554 11.144 11.880 10.549 9.787 a 2MASS J15554725+6840138 238.9463261 +68.6710286 10.66 3.05 145 2 51.8 4.8 0.8 -41.6 2.8 130.3 2.8 8.593 7.962 7.752 13.706 11.975 13.013 11.461 10.392 2MASS J10424990+2432086 160.7075097 +24.5356344 13.11 2.24 63 0 51.7 6.9 1.1 -81.9 4.5 -28.1 4.3 10.405 9.859 9.566 16.229 14.630 15.364 14.028 12.537 2MASS J09090798+2247413 137.2828922 +22.7945081 13.56 2.10 68 3 51.7 5.8 1.1 -88.9 4.9 -57.3 5.1 10.474 9.915 9.616 17.172 15.266 16.131 14.669 12.876 1RXS J044847.6+100302 72.1971961 +10.0504239 10.74 2.18 49 1 51.7 6.0 1.3 -81.5 5.6 -94.6 5.5 8.127 7.599 7.306 13.701 12.087 12.873 11.486 10.146 UPM1358+2752 209.7176772 +27.8706339 11.59 3.03 122 1 51.6 4.3 1.1 27.9 3.4 -3.1 3.2 9.052 8.589 8.337 14.715 13.055 13.817 12.471 11.090

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

2MASS J15102703+1328016 227.6130953 +13.4668508 12.31 3.03 97 0 51.6 4.8 1.1 102.0 3.0 -59.9 2.8 9.749 9.179 8.935 15.342 13.807 14.519 13.193 11.754 G 138-69 253.8596744 +12.4368344 12.13 3.06 95 0 51.5 7.6 1.1 88.4 4.7 -259.2 4.6 · · · · · · · · · 14.912 13.371 14.068 12.689 11.608 2MASS J17555802+2926097 268.9919731 +29.4359283 12.33 3.06 126 2 51.2 3.7 1.1 43.9 2.4 -24.1 2.4 9.759 9.183 8.909 · · · · · · · · · · · · · · · LP 300-45 57.4707408 +30.1470367 14.61 2.35 46 0 51.1 6.7 1.5 142.3 4.1 -298.8 3.8 · · · · · · · · · · · · · · · · · · · · · · · · BD+83 526 268.0037522 +83.0357386 10.33 3.04 144 1 51.0 7.2 0.8 -70.2 3.8 5.2 3.9 9.096 8.746 8.699 10.797 10.175 10.542 10.014 9.868 2MASS J08590927+2602569 134.7881700 +26.0505189 14.97 2.33 41 0 51.0 7.5 1.0 -94.8 6.5 321.6 6.3 · · · · · · · · · · · · · · · · · · · · · · · · UPM2202+5537 330.5849925 +55.6319386 14.08 2.38 87 0 50.9 4.8 1.6 145.0 3.6 0.1 3.3 11.006 10.417 10.113 · · · · · · · · · · · · · · · 2MASS J05455659+4738511 86.4849308 +47.6467019 14.71 2.26 58 0 50.9 5.0 1.2 -132.7 4.1 -200.1 3.8 11.882 11.351 11.002 · · · · · · · · · · · · · · · G 173-13 24.6014594 +45.2815608 12.06 2.31 112 2 50.6 3.9 1.1 318.4 3.2 -84.8 3.2 · · · · · · · · · 15.102 13.493 14.268 12.846 11.588 2MASS J21134479+3634517 318.4365525 +36.5806422 12.29 2.07 63 0 50.6 5.8 1.5 -27.3 4.9 -98.3 4.9 9.657 9.047 8.767 · · · · · · · · · · · · · · · 2MASS J08284121+6602239 127.1721472 +66.0403503 11.82 2.43 148 1 50.5 3.6 0.8 41.8 3.4 93.5 3.2 9.197 8.583 8.338 15.251 13.506 14.354 12.840 11.342 G 257-30 242.6168689 +73.9102486 13.39 3.08 152 1 50.4 4.9 0.8 -221.3 2.6 269.5 2.7 · · · · · · · · · 17.113 15.223 16.219 14.680 12.999 UPM2007+2723 301.9986189 +27.3835525 14.10 2.92 53 1 50.4 4.2 1.5 -93.0 4.2 7.5 4.2 10.828 10.264 9.937 · · · · · · · · · · · · · · · a LP 162-24 112.7875883 +47.7142461 14.98 2.38 61 0 50.3 6.0 1.1 -163.1 5.5 -285.9 4.9 · · · · · · · · · · · · · · · · · · · · · · · · NLTT 48486 294.8491392 +86.8658056 13.58 3.02 98 0 50.2 4.6 0.9 -174.8 5.5 79.5 5.5 11.118 10.515 10.270 16.704 14.999 15.799 14.402 13.018 G 249-30 90.3237667 +67.3618119 13.32 2.38 119 2 50.1 4.0 1.0 173.0 3.2 -282.8 2.9 · · · · · · · · · 16.456 14.911 15.585 14.244 12.869 UPM0217+5124 34.3036111 +51.4152483 15.58 2.29 38 0 49.9 6.9 1.1 -37.5 5.9 -68.8 5.9 11.869 11.266 10.964 · · · · · · · · · · · · · · · UPM1831+6524 277.7926831 +65.4088481 12.44 3.07 151 0 49.8 4.1 0.7 136.8 2.4 58.7 2.4 10.050 9.497 9.229 15.724 13.900 14.874 13.299 11.939 G 164-50 197.8849931 +29.5902528 12.94 3.04 126 0 49.7 4.5 1.0 -445.3 3.1 -83.6 2.9 · · · · · · · · · 16.007 14.422 15.195 13.856 12.416 LP 81-30 214.0469456 +23.3907739 10.82 3.04 100 3 49.7 5.0 1.0 -100.8 3.7 -173.6 3.7 8.713 8.167 7.928 13.445 11.862 12.751 11.284 12.262 UPM1930+2303 292.6617739 +23.0595664 14.73 2.29 43 0 49.7 7.8 3.1 -16.6 6.2 3.3 5.7 7.578 6.523 5.978 · · · · · · · · · · · · · · · a HD 154442 256.2272164 +14.1391400 10.27 3.06 60 0 49.7 9.3 1.0 -5.2 4.8 -4.4 4.6 9.272 9.138 9.066 10.548 10.139 10.343 10.058 9.978 a 2MASS J18541711+1058091 283.5714128 +10.9696861 12.16 3.03 68 0 49.7 5.2 1.9 12.6 5.4 122.7 4.5 9.376 8.694 8.483 · · · · · · · · · · · · · · · UPM1221+0939 185.2929358 +09.6578400 13.78 2.94 62 0 49.7 10.0 1.2 -35.5 5.1 -2.2 3.6 12.607 12.347 12.298 14.283 13.745 13.924 13.614 13.441 a G 237-51 183.0585014 +71.4238547 11.40 3.07 157 0 49.6 4.3 1.1 -373.0 3.4 167.5 3.4 · · · · · · · · · 14.311 12.827 13.546 12.223 10.803 UPM1638+2435 249.7352731 +24.5999469 14.50 2.85 55 0 49.6 6.8 1.0 133.1 4.0 44.2 3.9 11.348 10.792 10.474 · · · · · · · · · · · · · · · 2MASS J06272815+2129225 96.8678156 +21.4887792 14.36 2.18 41 0 49.6 6.9 1.0 129.1 4.6 -209.2 4.6 11.225 10.639 10.354 · · · · · · · · · · · · · · · UPM0928+8608 142.0627642 +86.1427444 14.08 3.01 61 0 49.5 5.7 1.1 -47.2 8.5 -44.1 8.5 11.619 10.941 10.754 16.608 15.263 16.080 14.684 13.478 UPM0347+6345 56.8243236 +63.7546764 16.01 2.35 41 1 49.5 6.7 1.9 120.3 5.7 47.0 5.4 12.504 11.913 11.561 · · · · · · · · · · · · · · · UPM2202+5538 330.5839367 +55.6384136 14.11 2.38 84 0 49.5 4.8 1.6 140.1 3.7 1.2 3.3 11.041 10.453 10.180 · · · · · · · · · · · · · · · UPM0446+2633 71.6809919 +26.5537969 15.04 2.31 45 0 49.5 7.7 2.7 40.9 5.4 -48.8 5.2 11.714 11.129 10.817 · · · · · · · · · · · · · · · 2MASS J20381440+2307524 309.5606369 +23.1313831 8.93 2.69 50 0 49.5 5.4 1.3 148.5 5.0 32.8 5.0 10.265 13.789 9.336 · · · · · · · · · · · · · · · c a NLTT 545 2.9403256 +68.6233517 15.40 2.36 44 0 49.4 6.7 3.1 -227.7 5.4 -64.4 5.3 11.946 11.346 11.030 · · · · · · · · · · · · · · · UCAC3 180-15288 68.6885444 -00.4472092 12.17 2.19 43 0 49.4 6.9 1.0 -79.6 6.8 -231.1 6.8 · · · · · · · · · 15.435 13.702 14.479 13.061 11.543 2MASS J00015110+6930084 0.4612342 +69.5020044 15.32 2.37 53 0 49.3 7.2 2.7 -157.1 5.8 -82.4 5.7 12.053 11.510 11.200 · · · · · · · · · · · · · · · UPM2319+5441 349.9068733 +54.6996456 12.44 2.19 113 0 49.2 8.9 1.2 -7.1 5.5 0.0 5.5 10.650 9.912 9.745 14.409 13.194 13.783 12.714 12.158 a 2MASS J00283035+4147101 7.1260806 +41.7859817 12.08 2.20 71 1 49.2 5.2 1.0 -83.9 3.8 -32.9 3.8 9.653 9.072 8.772 15.069 13.457 14.235 12.865 11.522 2MASS J05295425+2900425 82.4761819 +29.0110186 14.63 2.25 50 0 49.2 4.7 1.9 26.3 3.8 -172.8 3.8 11.563 10.948 10.699 · · · · · · · · · · · · · · · 2MASS J03273084+2212382 51.8788536 +22.2102881 13.03 2.38 52 0 49.2 7.4 1.2 76.6 4.7 -82.1 4.5 10.044 9.477 9.194 16.252 14.654 15.314 14.024 12.334 2E 2442 169.5849525 +13.7939939 11.67 2.08 81 1 49.2 7.8 1.3 80.4 5.0 -40.8 4.5 9.087 8.516 8.258 14.624 13.076 13.812 12.490 11.130 2MASS J09582501+0656562 149.6048747 +06.9489544 13.40 1.92 47 0 49.2 7.0 1.1 160.8 7.2 -21.6 6.9 10.804 10.202 9.954 16.462 14.717 15.492 14.061 12.772 UPM1650+3045 252.6695514 +30.7617911 14.63 2.85 58 0 49.1 6.6 1.0 100.1 3.7 -71.3 3.6 11.331 10.768 10.434 · · · · · · · · · · · · · · · LHS 2958 219.6386375 +41.5566081 14.80 2.89 55 1 49.0 7.5 1.0 -479.1 4.5 -418.1 4.0 · · · · · · · · · · · · · · · · · · · · · · · · UPM1519+1545 229.8869464 +15.7525708 12.85 3.03 95 1 49.0 6.2 1.0 0.6 3.3 -137.9 3.1 10.059 9.502 9.193 16.098 14.511 15.217 13.916 12.332 UPM1848+0447 282.2396064 +04.7865064 12.84 3.03 62 1 48.9 6.2 3.1 -100.7 4.4 -86.5 3.5 10.518 9.914 9.715 15.705 13.984 14.914 13.408 12.404 2MASS J06000658+2936555 90.0266189 +29.6137489 13.58 2.32 75 0 48.8 4.0 1.5 -146.8 3.0 -365.0 2.8 · · · · · · · · · · · · · · · · · · · · · · · · UPM1505-0153 226.3711950 -01.8957536 11.85 2.11 67 0 48.8 10.5 1.1 -13.1 6.1 6.5 5.8 10.918 10.641 10.566 12.453 11.885 12.128 11.763 11.595 a UPM0216+5511 34.0473872 +55.1975539 13.45 2.32 114 1 48.7 4.1 1.1 -28.1 3.2 -104.9 3.1 10.667 10.161 9.869 16.762 15.140 15.855 14.453 12.898 LP 339-3 309.0751936 +32.7925431 11.48 2.70 53 0 48.7 5.4 1.7 49.6 5.1 -168.5 5.1 9.284 8.691 8.478 14.116 12.601 · · · · · · · · · a UPM2010+2812 302.6534261 +28.2009489 13.84 2.92 51 1 48.7 5.0 1.5 127.5 4.7 -40.0 4.7 10.529 9.919 9.613 17.415 15.900 16.483 14.981 13.064 UPM0442+8030 70.6054914 +80.5141253 14.79 2.40 66 0 48.6 5.8 1.1 -62.1 6.8 -88.0 6.4 11.340 10.774 10.443 · · · · · · · · · · · · · · · UPM0259+6341 44.9562042 +63.6869889 16.35 2.34 30 0 48.6 6.2 1.9 65.1 4.5 -37.6 4.5 12.951 12.365 12.120 · · · · · · · · · · · · · · · UPM1000+1737 150.1717858 +17.6297675 13.86 2.09 69 0 48.6 8.9 0.8 -10.5 4.6 10.1 4.3 12.530 12.121 12.081 14.862 14.050 14.398 13.781 13.613 UPM1226+0740 186.7363536 +07.6809247 11.91 3.04 80 0 48.6 9.5 1.2 -57.8 6.0 52.4 4.9 10.689 10.308 10.237 12.736 12.084 12.325 11.911 11.735 2MASS J11291185+8442221 172.2933864 +84.7057925 15.53 2.02 35 0 48.5 7.8 1.2 -149.0 10.5 -80.7 10.5 12.548 11.933 11.693 · · · · · · · · · · · · · · · NLTT 44419 257.5400658 +76.9435175 14.30 3.06 118 0 48.5 5.4 0.7 -37.8 3.1 342.5 3.2 · · · · · · · · · · · · · · · · · · · · · · · · UPM0225+6127 36.3488844 +61.4537217 13.60 2.32 87 1 48.5 4.7 1.9 -92.7 3.5 -6.4 3.5 10.725 10.169 9.905 17.011 15.415 16.039 14.735 13.017 NLTT 51063 317.6766050 +85.8381703 14.43 2.04 61 0 48.4 7.1 0.9 160.7 6.3 -283.2 6.2 · · · · · · · · · 17.779 16.256 · · · · · · · · · UPM1248+6844 192.0124828 +68.7362600 13.15 3.09 161 0 48.4 4.3 0.8 -140.5 2.9 -59.5 2.7 10.676 10.138 9.883 16.552 14.654 15.655 14.096 12.624 UPM0316+3857 49.2323553 +38.9639183 12.92 2.35 103 0 48.4 3.6 1.1 -78.7 3.2 19.1 3.1 10.209 9.598 9.323 16.122 14.462 15.241 13.909 12.319 2MASS J09104829+3127268 137.7014078 +31.4572650 12.21 2.93 107 2 48.4 3.3 1.0 43.5 3.2 -47.6 3.4 9.722 9.139 8.871 15.393 13.773 14.538 13.143 12.381 G 131-70 7.2192672 +24.0523828 12.83 2.12 54 1 48.3 7.0 0.9 150.4 4.0 -254.9 3.9 · · · · · · · · · 15.686 14.081 14.876 13.432 12.522 UPM0535+6736 83.7896664 +67.6075803 14.68 2.30 70 1 48.2 4.9 1.1 -41.0 3.8 35.9 3.6 11.403 10.802 10.495 · · · 16.657 17.375 16.055 14.152 2MASS J16480454+4522429 252.0191764 +45.3787419 12.09 3.07 129 0 48.2 4.7 0.9 33.8 2.5 26.5 2.4 9.354 8.773 8.518 15.341 13.826 14.530 13.226 11.775

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

G 111-52 121.2630408 +41.3560689 13.73 2.37 105 3 48.2 3.7 1.1 -336.6 3.5 -206.8 3.3 · · · · · · · · · 16.906 15.358 16.169 14.733 13.269 UPM0458+2737 74.5472669 +27.6181156 14.19 2.22 48 0 48.2 7.3 2.7 86.8 6.0 -92.3 5.7 11.267 10.678 10.397 17.313 15.759 16.454 15.017 13.495 G 85-49 77.9208281 +26.9666556 13.44 2.21 59 0 48.1 5.4 3.1 209.1 4.5 -152.1 4.2 · · · · · · · · · 16.624 14.897 15.670 14.288 12.834 G 41-13 134.7187669 +21.0749017 12.54 2.10 55 0 48.1 4.8 1.0 183.6 4.7 -318.8 4.7 · · · · · · · · · 15.477 13.821 14.630 13.219 11.907 2MASS J22003629+7021113 330.1528822 +70.3534872 14.66 2.38 66 0 48.0 6.1 1.7 145.2 4.3 85.1 4.0 11.573 10.957 10.687 · · · · · · · · · · · · · · · 2MASS J07011069+1558280 105.2944692 +15.9737150 14.58 2.21 39 0 48.0 6.0 1.1 -10.4 5.0 -187.5 4.9 11.375 10.828 10.499 17.697 16.093 16.980 15.501 13.729 UPM2033+1430 308.2967925 +14.5047897 14.41 1.94 35 0 48.0 6.6 0.8 -13.2 6.9 -63.9 6.9 11.062 10.435 10.167 · · · · · · · · · · · · · · · UPM0419+0944 64.7839472 +09.7472275 12.59 2.22 55 0 48.0 5.6 1.4 45.4 4.5 131.8 4.4 9.990 9.409 9.156 15.620 13.999 14.707 13.379 12.038 UPM1738+7545 264.6761781 +75.7547681 14.14 3.09 119 2 47.9 5.1 0.8 -103.8 2.8 -93.3 2.8 11.683 11.129 10.873 · · · · · · · · · · · · · · · UPM2022+7454 305.7047547 +74.9051472 14.20 3.05 101 1 47.9 5.9 1.1 128.6 3.8 67.7 3.8 11.563 11.041 10.772 · · · · · · · · · · · · · · · WD 0810+489 123.5469192 +48.7572636 15.22 2.37 55 0 47.9 4.0 1.0 61.1 3.6 -254.9 3.4 · · · · · · · · · 15.397 15.023 15.168 14.923 14.912 UPM0002+2933 0.5839197 +29.5519533 12.84 2.27 65 0 47.8 6.1 1.3 11.1 4.0 -124.1 4.0 10.252 9.699 9.438 15.737 14.205 14.926 13.601 12.261 2MASS J13333371+7029412 203.3888753 +70.4948836 11.63 3.10 230 2 47.7 3.3 0.8 -127.7 2.5 20.9 2.5 9.227 8.608 8.342 14.906 13.122 14.131 12.599 11.200 UPM1226+5100 186.5788458 +51.0105903 15.48 3.07 42 1 47.7 7.1 1.2 38.0 5.0 39.1 4.9 12.179 11.611 11.312 · · · · · · · · · · · · · · · a UPM0902+1350 135.5509439 +13.8435500 13.97 2.31 36 0 47.7 7.0 1.0 6.3 5.2 -17.4 4.7 12.420 11.962 11.872 14.997 14.093 14.497 13.765 13.477 UPM0057+4850 14.3637792 +48.8470719 13.81 2.31 102 0 47.6 4.1 1.1 37.1 3.2 -134.7 3.2 11.093 10.527 10.260 17.153 15.399 16.055 14.772 13.253 UPM1306+1330 196.5830772 +13.5021900 13.82 2.97 76 3 47.6 9.7 1.1 -16.8 5.9 -119.8 4.6 10.757 10.194 9.891 17.411 15.533 16.411 14.882 13.150 UPM2015+4514 303.8871556 +45.2388386 14.85 2.26 64 0 47.5 5.5 1.4 5.7 4.0 -50.4 4.0 11.755 11.174 10.912 · · · · · · · · · · · · · · · UPM1633+3734 248.2523431 +37.5823206 16.08 2.85 34 0 47.5 7.9 1.0 28.1 4.8 -88.9 4.7 12.922 12.390 12.092 · · · · · · · · · · · · · · · LP 321-248 191.7431419 +27.8837319 14.29 2.90 67 0 47.5 5.9 1.1 -122.9 3.6 197.4 3.3 11.542 11.046 10.766 17.475 15.759 16.525 15.172 13.682 LHS 1514 48.0582522 +22.0183183 14.31 2.34 50 0 47.5 6.5 1.2 512.0 3.7 -560.7 3.7 · · · · · · · · · · · · · · · · · · · · · · · · UPM0641+1226 100.4287008 +12.4454108 13.36 2.28 54 0 47.5 6.1 1.2 14.0 5.2 -28.3 5.2 10.227 9.676 9.358 · · · · · · · · · · · · · · · UPM1527+0740 231.9386228 +07.6752689 10.26 3.03 80 1 47.5 7.1 1.0 100.3 4.1 16.9 4.1 8.149 7.530 7.278 12.942 11.448 12.167 10.816 9.848 NLTT 49084 302.3975278 +85.0522081 15.01 2.05 70 1 47.4 6.3 0.9 139.0 7.6 140.3 7.6 12.069 11.490 11.215 · · · · · · · · · · · · · · · 2MASS J23551516+5155292 358.8152342 +51.9250392 15.28 2.20 54 1 47.4 5.4 1.1 317.6 4.8 66.0 4.8 · · · · · · · · · · · · · · · · · · · · · · · · UPM2311+4320 347.9642106 +43.3368553 10.73 2.20 76 1 47.4 10.1 1.1 2.3 5.6 6.0 5.5 6.292 5.355 4.949 14.840 13.174 14.004 12.161 9.613 UPM0346+3626 56.7286689 +36.4498181 14.45 2.36 41 0 47.4 7.1 1.4 -6.6 5.2 -1.1 4.9 12.886 12.505 12.451 15.359 14.539 14.931 14.292 13.954 a UPM0603+3606 90.7673536 +36.1072114 13.71 2.33 62 1 47.4 4.5 1.2 38.1 3.8 -119.8 3.8 10.667 10.103 9.839 · · · · · · · · · · · · · · · LP 370-39 145.8812742 +23.9212917 14.15 2.29 57 1 47.4 6.6 0.9 -200.5 4.4 3.4 4.4 · · · · · · · · · · · · · · · · · · · · · · · · LHS 6297 238.7548381 +13.6626936 13.43 3.03 83 1 47.4 8.0 1.0 -328.6 4.4 317.2 4.3 · · · · · · · · · 16.362 14.825 15.572 14.179 12.941 LHS 3057 229.8229439 +67.8564144 11.90 3.04 158 1 47.3 4.1 0.9 -465.8 2.5 402.0 2.5 · · · · · · · · · 15.049 13.430 14.198 12.796 11.412 UPM0257+6319 44.2994556 +63.3231514 16.25 2.34 31 0 47.3 7.9 1.6 33.5 6.3 -107.1 6.2 12.624 12.011 11.717 · · · · · · · · · · · · · · · a UPM0210+4713 32.6890447 +47.2236286 13.39 2.34 120 0 47.3 3.7 0.9 84.6 3.0 -123.6 3.0 10.628 10.041 9.759 16.879 15.117 15.815 14.442 12.774 UPM0346+3719 56.7241542 +37.3315883 13.87 2.38 66 0 47.2 6.1 1.3 -14.6 4.8 0.2 4.6 12.207 11.756 11.637 15.483 14.358 14.916 14.013 13.541 LHS 3136 239.4996800 +20.5947286 12.97 3.04 123 2 47.2 4.0 0.9 158.9 2.5 -519.8 2.5 · · · · · · · · · 16.026 14.484 15.183 13.849 12.412 2MASS J16295465+0453253 247.4778758 +04.8900858 11.67 3.03 61 0 47.2 10.0 1.3 35.6 4.8 -84.6 4.6 9.150 8.564 8.296 14.610 13.073 · · · · · · 11.095 a UPM1939+6119 294.8044542 +61.3202861 11.09 3.05 86 0 47.1 4.9 1.2 34.8 3.4 -151.8 3.4 8.877 8.237 8.024 13.943 12.426 13.146 11.828 10.754 2MASS J22505505+4959132 342.7302097 +49.9870047 12.70 2.19 113 0 47.1 4.7 1.2 121.9 3.7 -3.9 3.6 9.804 9.210 8.920 · · · · · · · · · · · · · · · UPM0558+3911 89.6088814 +39.1996700 12.97 2.35 84 0 47.1 4.4 1.4 91.7 3.4 -92.9 3.4 10.200 9.608 9.334 16.237 14.604 15.344 13.978 12.375 LSPM J1811+1426 272.8634083 +14.4477097 10.99 3.03 62 0 47.1 6.7 1.1 -47.7 5.0 -168.8 5.0 8.882 8.268 8.075 13.436 11.971 12.706 11.351 10.500 2MASS J09594534+7211598 149.9387825 +72.2003314 11.55 2.96 168 3 47.0 4.2 1.0 -19.4 3.7 100.6 3.7 9.059 8.503 8.226 14.638 13.135 13.856 12.555 11.133 UPM2141+3650 325.2694964 +36.8460444 14.97 2.28 42 0 47.0 6.2 1.1 82.2 4.1 71.0 4.0 11.929 11.326 11.055 · · · · · · · · · · · · · · · UPM2331+2458 352.8951975 +24.9698622 13.75 2.19 54 1 47.0 6.5 1.1 12.2 3.5 3.4 3.5 12.453 12.053 11.971 14.609 13.821 14.181 13.624 13.407 G 100-19 83.5304544 +22.6616269 13.16 2.20 60 0 47.0 4.3 1.4 138.7 3.9 331.5 3.9 · · · · · · · · · 16.406 14.616 15.428 13.944 12.547 UPM2256+7600 344.1132328 +76.0027128 13.41 2.19 102 0 46.9 5.1 1.2 35.7 3.7 -36.0 3.7 10.614 10.015 9.774 · · · · · · · · · · · · · · · UPM0112+7450 18.1941597 +74.8478589 15.47 2.32 44 1 46.9 7.5 1.3 -4.7 5.9 1.3 5.6 13.599 13.001 12.836 16.908 15.849 16.412 15.449 14.938 UPM1013+1714 153.3039153 +17.2394892 14.47 2.06 48 1 46.9 7.7 1.2 -24.5 4.7 -25.7 4.4 12.121 11.504 11.251 17.029 15.447 16.187 14.906 13.930 UPM1916+8733 289.1744869 +87.5631528 14.59 2.04 57 1 46.8 5.3 1.0 30.1 7.1 183.4 7.1 12.120 11.473 11.254 17.275 15.867 16.622 15.298 13.937 UPM0940+3825 145.1380253 +38.4179669 14.76 2.37 60 0 46.8 4.8 1.2 -150.4 5.0 -28.9 4.9 11.618 11.051 10.745 · · · · · · · · · · · · · · · 2MASS J05534403+3150526 88.4332311 +31.8473647 13.73 2.32 70 0 46.8 4.8 1.4 -48.7 3.5 -153.8 3.5 10.711 10.169 9.859 · · · · · · · · · · · · · · · UCAC2 35205366 122.5860875 +09.5876461 10.86 2.36 37 0 46.8 7.4 1.0 -88.7 9.2 -24.3 9.2 8.382 7.807 7.510 13.398 11.919 12.643 11.341 10.357 UPM0959+0722 149.7679944 +07.3795817 12.96 1.97 56 0 46.8 7.7 1.2 34.8 7.0 -114.3 6.8 10.777 10.134 9.938 15.211 13.804 14.509 13.190 12.399 2MASS J16060319+0333215 241.5129383 +03.5556336 11.71 3.02 79 1 46.8 7.6 0.9 -120.4 3.3 -90.3 2.7 9.643 9.030 8.803 14.183 12.726 13.476 12.119 11.310 NLTT 12285 60.1894536 +62.8784658 14.90 2.35 64 0 46.7 4.7 1.9 115.9 4.1 -297.9 3.8 · · · · · · · · · · · · · · · · · · · · · · · · UPM0040+3354 10.1504528 +33.9025858 13.93 2.27 64 0 46.7 5.8 0.9 114.4 4.2 29.3 4.1 10.975 10.401 10.098 17.226 15.571 16.297 14.934 13.285 UPM2316+3728 349.0682233 +37.4681050 12.88 2.20 78 0 46.6 6.0 1.5 42.0 3.7 -111.7 3.7 10.413 9.793 9.526 15.677 14.132 14.866 13.562 12.306 UPM1227+0745 186.7855950 +07.7572922 12.47 3.04 86 1 46.6 9.8 1.2 -39.3 5.9 -6.7 4.7 11.113 10.630 10.552 13.688 12.770 13.162 12.506 12.262 a NLTT 50141 313.1423228 +73.2763633 14.91 3.02 54 0 46.5 7.0 2.9 270.5 4.7 219.1 4.7 · · · · · · · · · · · · · · · · · · · · · · · · UPM2106+4437 316.5691072 +44.6169197 13.95 2.30 74 0 46.5 4.1 1.8 -16.3 3.2 -136.8 3.1 10.969 10.396 10.128 · · · · · · · · · · · · · · · G 171-61 8.0024169 +43.9426172 11.80 2.27 70 1 46.5 5.5 1.1 296.4 3.9 -268.1 3.9 · · · · · · · · · 14.463 12.940 13.738 12.333 11.382 UPM2206+3533 331.7149133 +35.5505475 14.82 2.11 45 0 46.5 6.2 0.8 30.1 4.6 38.4 4.6 11.996 11.424 11.202 · · · · · · · · · · · · · · · a UPM1217+1123 184.2968089 +11.3918492 11.01 2.94 69 3 46.5 9.6 1.2 -39.4 5.9 48.3 5.4 8.878 8.247 8.022 13.562 12.096 12.870 11.469 10.584 UPM1118+1005 169.7027600 +10.0978061 12.47 2.94 78 0 46.5 8.8 0.9 -21.3 5.8 -16.1 4.9 11.429 11.188 11.146 12.971 12.464 13.000 12.407 13.015 a StKM 1-407 56.6384683 -00.3843100 10.81 2.19 43 1 46.5 7.5 1.1 -58.2 6.7 -14.9 6.7 8.988 8.388 8.205 12.711 11.489 12.110 10.929 10.430 a

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

TYC 4866-825-1 128.0032611 -02.8015181 11.80 2.32 67 0 46.5 10.5 0.9 55.1 7.1 -33.2 6.4 10.683 10.457 10.404 12.315 11.764 12.016 11.589 11.499 a UPM2325+4717 351.4092967 +47.2849086 10.62 2.20 91 2 46.4 8.0 1.1 30.1 4.8 9.0 4.8 8.260 7.682 7.463 13.201 11.739 12.434 11.160 9.989 a 2MASS J17553277+1648587 268.8901367 +16.8145761 14.00 3.03 61 0 46.4 7.5 1.4 894.9 4.6 -447.4 4.5 · · · · · · · · · 16.986 15.293 16.033 14.634 13.331 LHS 6064 56.3176778 +04.0422650 14.08 2.12 38 0 46.4 7.9 1.2 298.4 6.4 -369.2 6.3 · · · · · · · · · 17.237 15.394 16.294 14.742 13.058 LP 51-17 15.2037344 +66.9483181 11.86 2.35 99 2 46.3 4.5 2.8 -237.5 3.5 -51.8 3.3 · · · · · · · · · 14.986 13.425 14.086 12.772 11.347 Cl* Melotte 22 MT 113 58.2693919 +22.3045483 14.30 2.38 41 0 46.3 7.1 1.1 319.7 4.2 -56.4 4.1 · · · · · · · · · 17.076 15.451 16.242 14.877 13.592 LP 279-37 276.9911089 +37.4055472 10.97 2.99 53 0 46.2 7.0 1.3 -2.4 5.1 339.8 5.1 · · · · · · · · · · · · · · · · · · · · · · · · c LP 415-213 68.5993522 +20.8818425 14.28 2.27 39 0 46.2 6.3 1.7 27.7 5.9 -219.8 5.6 · · · · · · · · · · · · · · · · · · · · · · · · a 2MASS J15183145+2036279 229.6310922 +20.6082000 13.41 3.04 79 1 46.0 6.2 1.4 7.9 3.7 94.8 3.8 10.119 9.606 9.268 · · · 15.455 · · · · · · 12.641 LP 473-9 54.1097147 +11.8006353 12.60 2.20 68 0 46.0 6.0 1.6 231.8 4.7 -123.8 4.6 · · · · · · · · · 15.343 13.822 14.570 13.197 12.121 GJ 3805 206.5072114 +57.0098564 13.93 3.08 96 0 45.9 3.9 1.0 -200.4 2.7 187.8 2.6 13.704 13.821 13.757 13.472 13.428 13.326 13.575 13.829 2MASS J17311988+3008217 262.8318750 +30.1392661 13.78 3.04 66 0 45.9 5.3 1.0 -189.8 3.1 -23.2 3.1 10.944 10.386 10.096 17.164 15.379 16.214 14.801 13.158 UPM1821+2005 275.3955981 +20.0851344 13.91 3.04 69 1 45.9 4.5 1.3 30.0 2.7 41.2 2.8 11.139 10.601 10.331 · · · · · · · · · · · · · · · UPM0151+4729 27.9230722 +47.4888397 13.27 2.31 132 1 45.8 3.4 1.1 122.6 2.8 -60.5 2.7 10.671 10.124 9.844 16.565 14.814 15.621 14.227 12.773 2MASS J13360002+4024118 204.0002997 +40.4034097 13.72 3.09 105 2 45.8 4.1 1.1 38.9 2.9 24.3 2.8 10.717 10.090 9.823 · · · · · · · · · · · · · · · UPM0447+3433 71.9955186 +34.5605478 14.06 2.39 79 1 45.8 6.9 3.3 5.8 5.3 3.9 5.1 10.919 9.975 9.659 · · · · · · · · · · · · · · · a 2MASS J20483385+1952450 312.1415339 +19.8795267 13.12 1.98 39 0 45.8 6.6 0.9 106.5 4.9 80.7 4.9 10.171 9.568 9.278 16.319 14.551 15.264 13.943 12.314 UPM0031+4758 7.8624258 +47.9697806 15.15 2.21 45 0 45.7 6.9 0.9 14.2 5.6 5.1 5.6 13.845 13.477 13.512 15.898 15.139 15.561 14.936 14.773 UPM0255+3422 43.9693917 +34.3810050 14.67 2.34 58 0 45.7 5.8 1.0 22.9 4.6 -121.7 4.6 11.716 11.136 10.839 · · · · · · · · · · · · · · · UPM0218+6958 34.6757342 +69.9754608 11.65 2.31 127 3 45.6 5.6 3.3 -10.0 4.0 11.5 3.9 9.796 9.208 9.003 13.790 12.428 13.212 11.993 11.352 G 262-25 310.7457844 +66.8431003 10.93 3.00 94 2 45.6 5.0 1.4 -247.5 4.0 -182.0 3.8 · · · · · · · · · · · · · · · · · · · · · · · · UPM1420+6126 215.0591292 +61.4421783 15.01 3.09 59 0 45.6 6.3 1.0 -97.2 4.6 -41.3 4.6 11.485 10.855 10.549 · · · · · · · · · · · · · · · G 202-63 248.8519847 +45.6500497 13.50 3.07 108 0 45.6 6.0 1.0 19.7 2.9 -286.6 2.9 · · · · · · · · · 16.836 15.092 15.887 14.476 13.025 UPM1659+3822 254.7671833 +38.3829986 14.18 3.05 85 1 45.6 5.1 1.2 68.1 3.1 -28.1 3.1 11.058 10.466 10.190 · · · · · · · · · · · · · · · UPM0530+3217 82.7200556 +32.2880764 14.08 2.25 72 1 45.6 4.4 1.3 84.5 3.2 -17.9 3.1 11.122 10.549 10.235 · · · · · · · · · · · · · · · UPM2148+2901 327.0247561 +29.0276306 14.48 2.10 38 1 45.6 6.8 1.0 33.4 4.1 -52.7 4.0 11.760 11.119 10.877 17.090 15.713 16.327 15.046 13.718 UPM2305+2856 346.3526281 +28.9437497 13.69 2.18 44 1 45.6 7.7 0.9 -69.3 3.7 -57.7 3.6 11.069 10.468 10.237 16.455 14.862 15.678 14.269 13.002 UPM2331+2507 352.9305914 +25.1328122 11.98 2.19 65 2 45.6 7.0 1.1 32.5 3.7 -1.2 3.6 10.687 10.326 10.239 12.906 12.141 12.495 11.934 11.699 a 2MASS J21055604+2309450 316.4828953 +23.1617453 13.75 2.06 41 0 45.6 4.4 1.1 -162.1 4.1 -203.8 4.1 10.877 10.258 10.056 16.736 15.196 15.846 14.559 12.997 a NLTT 47551 288.2033089 +53.7209297 13.75 3.08 119 1 45.5 2.2 1.0 144.4 1.9 138.1 1.9 13.616 13.734 13.824 13.114 13.132 13.066 13.350 13.636 UPM2006+4533 301.7396747 +45.5542167 12.80 2.95 114 1 45.5 3.6 1.2 35.9 2.8 28.8 2.8 10.182 9.590 9.326 · · · · · · · · · · · · · · · UPM1121+3206 170.3037617 +32.1006458 13.49 2.94 64 4 45.5 5.9 1.1 107.5 4.4 -39.1 4.3 10.815 10.245 9.982 16.546 14.964 15.651 14.356 12.884 EGGR 344 118.3630075 +52.4910639 16.10 2.37 33 0 45.4 6.9 0.9 -88.3 6.8 -256.7 6.2 · · · · · · · · · 15.943 15.597 15.676 15.542 15.677 2MASS J05430736+3637012 85.7799478 +36.6167756 16.00 2.26 31 0 45.4 4.5 1.3 -159.4 3.6 -48.1 3.6 14.783 14.595 14.507 16.246 15.679 15.982 15.534 15.284 2MASS J07181290+1342167 109.5536322 +13.7044997 12.07 2.29 39 0 45.4 5.4 1.0 -35.6 5.0 -40.9 4.8 9.361 8.689 8.448 · · · · · · · · · · · · · · · UPM1543+0648 235.8586592 +06.8004761 13.17 3.03 63 0 45.4 7.6 0.9 41.2 3.9 -19.1 3.8 10.516 9.932 9.715 16.177 14.687 15.355 14.075 12.658 a UPM1148+0513 177.1494936 +05.2287442 12.25 2.94 68 2 45.4 9.3 1.1 35.4 5.5 -66.1 4.7 10.802 10.365 10.224 13.367 12.520 12.893 12.235 11.951 a G 238-52 207.7357267 +62.4181183 14.07 3.09 100 0 45.3 4.5 0.8 -384.8 3.2 -126.9 3.2 · · · · · · · · · · · · · · · · · · · · · · · · UPM0458+6041 74.7125597 +60.6964067 14.26 2.38 77 1 45.3 4.8 2.0 26.4 4.2 31.3 4.0 11.413 10.881 10.601 · · · · · · · · · · · · · · · a UPM0640+5242 100.1928725 +52.7078614 13.12 2.38 136 3 45.3 3.3 1.1 38.4 2.8 -6.4 2.5 10.421 9.881 9.622 16.455 14.797 15.539 14.172 12.652 UPM0159+4855 29.9354142 +48.9282297 13.44 2.34 119 1 45.3 4.9 1.1 43.0 3.8 100.2 3.7 10.878 10.280 10.035 · · · · · · · · · · · · · · · UPM1139+7724 174.8604711 +77.4011044 13.76 3.07 119 0 45.2 4.3 1.0 -0.2 3.6 97.3 3.5 10.724 10.136 9.854 17.198 15.612 16.311 14.940 13.086 UPM0340+2950 55.1111650 +29.8418014 13.38 2.37 63 0 45.2 6.9 1.3 28.1 5.1 -3.6 4.4 11.980 11.655 11.481 14.591 13.759 14.139 13.408 13.072 a LP 345-16 343.8655089 +29.5502578 13.47 2.19 47 0 45.2 7.8 1.6 -256.4 3.6 66.4 3.6 · · · · · · · · · 16.451 14.813 15.532 14.137 12.910 G 142-54 297.0763867 +17.7926778 11.33 2.94 51 1 45.2 4.8 3.9 114.1 5.2 221.0 4.9 · · · · · · · · · · · · · · · · · · · · · · · · d UPM0918+1538 139.6195189 +15.6467894 11.71 2.31 37 1 45.2 6.8 1.1 20.1 5.7 -18.8 5.6 10.036 9.507 9.360 12.806 11.878 12.280 11.559 11.233 UPM1944+0528 296.0701286 +05.4828456 13.41 1.97 40 0 45.2 7.7 2.2 361.5 8.9 -20.7 7.8 · · · · · · · · · · · · · · · · · · · · · · · · UPM2355+5251 358.9272283 +52.8655472 15.46 2.20 31 0 45.1 7.6 1.1 9.4 6.6 3.0 6.6 13.720 13.266 13.196 · · · · · · · · · · · · · · · UPM1035+2009 158.8945572 +20.1584908 14.02 2.06 65 0 45.1 9.5 1.1 50.2 5.4 -112.3 5.0 11.395 10.802 10.525 · · · · · · · · · · · · · · · UPM2257+1922 344.4018839 +19.3705403 14.03 2.19 42 1 45.1 7.3 0.9 -61.0 3.6 11.1 3.6 11.035 10.418 10.148 17.078 15.422 16.205 14.789 13.161 UPM1153+1124 178.4421772 +11.4138933 12.80 2.94 79 0 45.1 9.1 1.1 -27.7 4.6 -3.5 4.2 11.641 11.308 11.200 13.653 12.978 13.256 12.816 12.597 UPM0746+0138 116.5719672 +01.6492658 13.93 2.25 37 0 45.1 7.1 0.9 -50.2 4.8 14.2 4.4 10.982 10.466 10.151 16.891 15.272 16.098 14.681 13.180 2MASS J13181352+7322073 199.5574211 +73.3683058 12.04 3.10 216 2 45.0 3.2 1.0 69.2 2.4 -114.8 2.4 9.541 8.926 8.740 15.059 13.548 14.356 13.068 11.533 UPM0919+6227 139.9539239 +62.4505875 14.32 2.37 74 0 45.0 4.1 0.9 -100.2 3.8 -68.1 3.7 11.246 10.685 10.355 17.934 16.206 17.040 15.505 13.645 LHS 2886 214.1767806 +36.0124122 11.50 3.05 129 1 45.0 3.9 1.2 279.0 2.7 -438.6 2.6 · · · · · · · · · 14.158 12.552 13.333 11.973 10.920 G 246-23 46.6189475 +62.9095281 13.94 2.34 95 2 44.9 4.0 1.9 357.1 3.2 -305.3 3.1 · · · · · · · · · · · · 15.650 16.523 14.911 13.265 LHS 1728 75.6941253 +61.5137417 12.12 2.39 129 0 44.9 3.7 1.7 586.9 3.0 6.2 3.0 · · · · · · · · · 15.043 13.657 14.235 13.083 11.648 2MASS J03094705+5249579 47.4475019 +52.8325856 14.34 2.35 84 0 44.9 5.2 2.2 203.9 3.9 -42.0 3.9 11.291 10.690 10.396 · · · · · · · · · · · · · · · HD 30617B 72.7175731 +37.7785886 13.94 2.39 92 0 44.9 4.2 2.4 47.7 3.5 34.7 3.4 11.618 11.080 10.828 16.836 15.161 15.834 14.522 13.489 LTT 18223 188.8748939 +28.8984672 13.41 2.90 102 0 44.8 6.1 1.4 -212.3 3.7 -251.1 3.1 · · · · · · · · · · · · · · · · · · · · · · · · UPM0518+2005 79.6915606 +20.0978000 12.99 2.20 56 1 44.8 3.8 1.5 -28.1 3.5 -39.8 3.4 10.215 9.630 9.383 16.044 14.439 15.164 13.726 12.258 TYC 300-1017-1 201.3890308 +02.3876136 10.87 3.02 67 1 44.8 8.6 1.3 -20.4 5.0 -18.3 4.7 9.697 9.389 9.294 11.811 11.021 11.357 10.804 10.631 a UPM0408+2008 62.0822017 +20.1416322 13.66 2.31 54 0 44.7 6.3 1.6 54.0 4.0 -95.1 4.0 10.819 10.232 9.946 16.598 15.023 15.804 14.398 12.916 TYC 968-1161-1 247.8779831 +12.8426947 11.30 3.03 74 1 44.7 8.1 0.9 -1.1 4.1 -17.4 4.1 10.108 9.808 9.728 12.068 11.375 11.646 11.186 10.998 a

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

UPM1422+7043 215.5470128 +70.7276564 14.46 3.09 96 0 44.6 5.7 0.9 73.2 3.8 4.1 3.8 11.633 11.039 10.740 18.470 16.267 17.198 15.669 13.832 LP 162-65 116.5458319 +45.4324567 16.08 2.37 35 0 44.6 7.8 0.9 -26.6 7.6 -392.3 6.8 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J21362714+2500088 324.1142539 +25.0028650 14.26 2.09 32 0 44.6 7.8 1.0 255.8 5.6 107.8 5.6 · · · · · · · · · · · · · · · · · · · · · · · · UPM0835+4230 128.7725922 +42.5089797 14.39 2.36 74 1 44.5 4.7 1.1 4.9 4.1 25.0 3.9 11.288 10.700 10.433 17.900 16.112 16.938 15.460 13.821 LHS 2672 195.6947656 +41.5186003 11.54 3.07 103 2 44.5 5.5 1.1 -548.8 3.7 -175.1 3.7 · · · · · · · · · 14.569 12.962 13.724 12.356 11.032 UPM0359+4032 59.8698386 +40.5345006 14.94 2.35 49 1 44.5 5.3 2.5 12.0 4.0 -11.8 3.9 12.887 12.173 12.051 17.235 15.659 16.474 15.122 14.480 a UPM1542+1907 235.5830089 +19.1196867 14.84 2.84 58 0 44.5 6.1 1.2 -47.4 4.1 30.1 4.0 12.000 11.451 11.165 18.094 16.146 · · · · · · 14.182 LP 165-26 137.2026158 +46.9304011 14.03 2.36 57 0 44.4 6.7 1.1 98.4 6.2 -273.1 6.1 · · · · · · · · · · · · · · · · · · · · · · · · GD 95 131.6843092 +35.6423869 15.28 2.34 46 1 44.4 4.8 1.0 -147.9 4.3 -67.9 4.2 14.678 14.628 14.592 15.080 14.767 14.763 14.887 14.987 UPM0123+3219 20.7864542 +32.3305719 15.30 2.19 35 1 44.4 6.8 1.1 149.0 5.1 17.9 4.8 12.099 11.524 11.261 · · · · · · · · · · · · · · · 2MASS J15153756+6349528 228.9069647 +63.8308856 10.95 3.06 116 1 44.3 5.0 0.9 52.4 3.2 -108.3 3.1 8.992 8.407 8.150 13.693 12.125 12.953 11.513 10.555 UPM1548+5605 237.1225603 +56.0980008 10.16 2.99 83 0 44.3 6.3 1.1 -127.7 4.8 -126.3 4.7 8.363 7.933 7.840 10.632 9.902 10.417 9.570 9.243 2MASS J18491697+5556530 282.3216189 +55.9479069 12.17 3.08 150 3 44.3 3.5 0.8 119.9 2.3 -40.2 2.3 9.791 9.244 9.003 15.360 13.524 14.414 13.019 11.758 LHS 5238 196.7423344 +27.8484081 12.48 3.04 126 2 44.3 4.1 1.1 -345.2 2.8 -326.7 2.6 · · · · · · · · · 15.546 13.838 14.654 13.219 12.047 G 187-33 318.8030728 +25.7949322 10.96 2.06 37 1 44.3 6.9 1.1 139.4 6.9 -257.5 6.9 · · · · · · · · · 13.569 12.084 12.800 11.552 10.279 UPM1034+2328 158.6907803 +23.4716811 12.98 2.25 69 2 44.3 7.4 1.0 -1.9 4.5 -15.3 4.3 11.622 11.099 11.047 14.135 13.244 13.679 12.950 12.698 a UPM1543+1926 235.7579358 +19.4438433 13.32 3.04 88 0 44.3 5.3 1.1 -97.2 3.2 -59.4 3.2 10.932 10.352 10.139 15.958 14.560 15.263 13.938 12.851 2MASS J11333555+4905254 173.3982356 +49.0905200 12.00 3.04 138 2 44.2 3.9 1.1 21.2 3.3 36.1 3.2 9.573 8.992 8.730 15.163 13.483 14.320 12.881 11.704 a UPM1402+2102 210.5254094 +21.0460169 11.69 2.97 108 2 44.2 5.4 1.0 20.5 3.3 23.9 3.1 8.958 8.313 8.076 14.983 13.335 14.091 12.715 11.122 LP 425-244 129.0266350 +17.0119483 13.83 2.28 43 0 44.2 7.1 1.0 80.9 5.8 -310.3 4.4 · · · · · · · · · 16.860 15.380 16.071 14.795 13.105 UPM2344+5102 356.1452411 +51.0396450 11.18 2.25 102 1 44.1 5.5 1.1 -58.1 4.1 -2.6 4.1 9.189 8.609 8.415 13.834 12.362 13.101 11.745 10.833 UPM0438+2935 69.5054514 +29.5894033 12.41 2.38 108 0 44.1 4.9 2.6 23.3 4.0 30.2 3.7 10.026 9.424 9.176 15.365 13.852 14.569 13.235 11.961 UPM1720+8051 260.2444903 +80.8636681 16.53 2.97 31 0 44.0 7.9 0.8 -19.8 5.7 19.5 5.7 14.500 13.843 13.731 · · · · · · · · · · · · · · · UPM1707+6709 256.7684378 +67.1615611 14.38 3.09 112 0 44.0 6.8 0.9 -48.2 3.3 71.0 3.4 11.401 10.820 10.518 · · · · · · · · · · · · · · · 2MASS J21592435+4027339 329.8518350 +40.4606444 14.32 2.14 55 0 44.0 5.0 1.0 75.0 3.3 282.2 3.3 · · · · · · · · · 17.456 15.698 16.675 15.109 13.554 UPM0030+2656 7.5298222 +26.9482267 14.96 2.09 34 0 44.0 7.2 1.0 -126.6 4.7 -89.2 4.7 12.106 11.529 11.288 · · · · · · · · · · · · · · · UPM0226+1331 36.5936769 +13.5209547 13.59 2.15 36 1 44.0 7.9 1.1 -85.6 3.8 11.5 3.5 10.730 10.238 9.969 16.387 14.779 15.547 14.219 12.914 UPM1311+0441 197.8691806 +04.6894536 13.54 2.97 76 0 44.0 8.8 1.1 -126.8 5.0 48.2 3.7 11.566 10.869 10.753 15.865 14.476 15.197 13.885 13.185 UCAC3 322-27964 67.5489942 +70.8206381 10.88 2.39 126 1 43.9 4.7 0.9 -113.3 4.1 27.7 4.0 8.753 8.181 7.939 13.471 12.019 12.855 11.456 10.450 2MASS J04542981+6504411 73.6248069 +65.0776978 12.37 2.38 121 1 43.9 3.7 1.2 52.2 3.2 -104.7 3.2 9.668 9.085 8.832 15.733 14.059 14.818 13.441 11.840 LHS 2888 214.4165639 +20.9416711 12.13 3.03 118 1 43.9 4.6 1.1 -135.9 3.2 -613.3 3.1 · · · · · · · · · 14.954 13.387 14.144 12.853 11.651 UPM1542+1936 235.7040603 +19.6071367 14.94 2.84 49 0 43.9 6.6 1.1 -28.3 4.0 -19.3 3.9 12.961 12.336 12.138 16.854 15.621 16.352 15.000 14.458 a UPM2136+1633 324.1889692 +16.5595847 12.98 2.03 45 1 43.9 6.7 0.9 -22.6 4.8 -29.7 4.6 10.098 9.523 9.262 15.825 14.344 15.030 13.743 12.278 StKM 1-1250 232.9167383 +10.6870442 10.72 3.03 76 2 43.9 8.1 1.2 90.7 4.8 -30.2 4.7 8.716 8.076 7.855 13.179 11.726 12.438 11.079 10.291 G 237-61 185.4439203 +68.2686086 11.15 3.06 191 6 43.8 3.7 1.0 -362.4 3.1 202.9 3.0 · · · · · · · · · 14.156 12.498 13.381 11.977 10.695 2MASS J10325367+5537529 158.2235825 +55.6302089 15.01 2.78 44 0 43.8 7.3 1.0 -21.0 6.9 -309.9 6.9 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J15182698+5149486 229.6115319 +51.8305119 13.87 3.06 87 0 43.8 5.6 1.0 -128.7 3.2 74.2 3.2 11.072 10.502 10.254 17.230 15.542 16.268 14.908 13.408 2MASS J05071449+3730421 76.8098197 +37.5116939 13.38 2.28 95 1 43.8 4.0 1.4 -100.7 3.7 -1.8 3.6 10.284 9.703 9.397 16.986 15.349 16.031 14.575 12.714 UPM0447+3441 B 71.8743669 +34.6941350 13.60 2.39 96 2 43.8 6.7 3.5 22.6 5.6 -37.5 5.3 11.699 11.074 10.932 15.743 14.372 15.089 13.881 13.351 a LHS 2107 136.8693622 +33.0781764 14.49 2.34 60 1 43.8 5.2 0.9 -705.9 4.9 -147.2 4.7 · · · · · · · · · · · · · · · · · · · · · · · · UPM1505+1804 226.3783933 +18.0816272 13.35 3.08 126 2 43.8 4.3 1.3 -105.0 2.4 95.9 2.3 10.528 9.922 9.673 · · · · · · · · · · · · · · · 2MASS J06313385+0546508 97.8909094 +05.7802650 11.83 2.28 56 1 43.8 5.2 1.1 -24.2 6.5 -128.9 6.4 9.578 8.971 8.740 14.509 13.010 13.770 12.414 11.398 LP 19-387 177.8616711 +79.7682039 15.64 3.07 52 0 43.7 6.6 1.0 -286.3 5.9 103.3 5.5 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J22475104+5333324 341.9654917 +53.5588225 16.05 2.32 34 1 43.7 6.6 1.3 384.3 5.2 -44.9 5.2 · · · · · · · · · · · · · · · · · · · · · · · · G 120-65 174.6680431 +23.7299550 11.65 2.87 88 2 43.7 6.0 1.0 -228.2 3.9 5.8 3.6 · · · · · · · · · 14.335 12.807 13.597 12.155 11.258 G 170-32 259.7739692 +22.8831942 11.62 3.06 85 1 43.7 7.4 1.0 -26.7 3.0 -246.4 2.6 · · · · · · · · · 14.182 12.610 13.466 12.023 11.162 UPM1720+2043 260.0000281 +20.7328292 13.81 3.03 59 1 43.7 10.5 1.1 22.0 4.0 47.2 3.6 11.153 10.558 10.291 16.591 15.090 15.751 14.495 13.094 a G 120-35 170.3137347 +25.2733394 12.55 2.87 88 0 43.6 6.9 1.2 -346.7 4.6 -92.5 4.4 · · · · · · · · · 15.527 13.878 14.649 13.283 12.011 2MASS J03015425+2207535 45.4765744 +22.1311086 14.54 2.34 43 0 43.6 7.7 1.4 151.5 4.6 -113.0 4.6 11.737 11.130 10.876 17.780 15.920 16.639 15.327 13.837 UPM2330+2032 352.5320081 +20.5403042 12.11 2.19 58 2 43.6 6.2 0.9 15.4 3.8 -16.0 3.9 9.811 9.193 8.947 14.749 13.244 · · · · · · 11.361 LP 625-3 245.3405800 +01.4213289 12.65 3.02 61 1 43.6 7.5 0.9 -251.3 3.3 -99.5 2.8 · · · · · · · · · 15.623 14.066 15.040 13.449 12.078 UPM0813-0315 123.3062039 -03.2594875 13.71 2.24 38 0 43.6 7.9 1.0 -17.5 6.1 20.1 5.9 12.397 12.122 12.068 14.267 13.615 13.905 13.424 13.291 G 231-32 318.0965950 +59.2477433 13.49 2.31 119 0 43.5 3.7 2.0 17.3 3.1 -360.3 3.0 · · · · · · · · · 16.956 15.211 15.875 14.478 12.982 2MASS J01574055+5308134 29.4235375 +53.1368272 14.61 2.29 63 0 43.5 4.6 1.2 658.1 3.9 -60.3 3.9 · · · · · · · · · · · · · · · · · · · · · · · · UPM0408+3911 62.2096897 +39.1916061 15.84 2.35 34 0 43.5 7.0 3.2 76.5 5.2 -52.9 5.2 12.763 12.153 11.886 · · · · · · · · · · · · · · · UPM2204+2801 331.1528064 +28.0271450 12.79 2.13 66 0 43.5 8.4 1.0 11.0 3.2 12.3 3.2 11.695 11.416 11.405 13.377 12.800 13.053 12.658 12.506 a LP 359-186 75.7739814 +21.3760997 12.92 2.18 48 1 43.5 6.5 1.5 96.8 5.7 -135.8 5.7 9.750 9.165 8.888 16.423 14.632 15.445 14.017 12.149 BD+21 2602B 211.0378233 +20.7419717 10.62 2.97 97 0 43.5 5.1 1.1 -128.6 4.0 -15.3 3.9 8.590 7.913 7.697 13.147 11.610 12.435 10.984 10.132 UPM0957+0732 149.4456486 +07.5443989 13.54 2.94 42 0 43.5 7.1 1.2 -18.6 7.7 -32.9 7.5 12.106 11.730 11.645 14.290 13.493 13.824 13.267 13.077 a G 253-53 174.5845872 +81.8088864 10.70 3.02 127 4 43.4 4.5 0.9 430.4 4.1 11.9 4.1 · · · · · · · · · 13.201 11.706 12.534 11.111 10.336 UPM2226+8012 336.5103722 +80.2135789 15.77 2.36 36 0 43.4 7.0 1.1 129.2 5.7 38.5 5.5 12.576 12.060 11.761 · · · · · · · · · · · · · · · LHS 6234 187.2876108 +62.6598350 12.51 3.08 154 3 43.4 3.5 0.9 -284.2 2.5 -266.0 2.5 · · · · · · · · · 15.667 14.041 14.894 13.382 12.039 GD 309 171.7195003 +59.3212142 15.68 2.86 42 0 43.4 4.8 1.1 151.6 4.2 -50.6 4.0 15.048 15.176 15.096 15.243 15.057 15.101 15.175 15.300 G 193-36 107.9572339 +50.0934881 12.62 2.39 148 3 43.4 3.4 1.1 153.3 2.9 173.9 2.8 10.236 9.692 9.434 15.748 14.072 14.879 13.452 12.201

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

G 111-17 113.7690369 +45.1903122 12.70 2.40 114 4 43.4 3.5 1.0 -218.6 3.3 -375.9 3.1 · · · · · · · · · 15.892 14.176 14.936 13.562 12.253 UPM0447+3441 A 71.8231581 +34.6839811 12.87 2.39 109 1 43.4 6.5 3.4 1.7 5.5 1.5 5.2 11.183 10.727 10.600 14.682 13.540 14.135 13.139 12.624 a UPM0331+1836 52.9179711 +18.6025003 12.80 2.23 57 1 43.4 5.8 1.0 -37.3 4.3 -12.3 4.3 10.060 9.478 9.222 15.809 14.356 14.966 13.641 12.263 a TYC 237-1382-1 148.9545244 +02.2577142 12.05 1.97 53 0 43.4 6.3 0.9 -11.1 5.8 -13.1 5.6 10.847 10.502 10.416 12.942 12.165 12.495 11.928 11.751 UPM1855+5342 283.9239831 +53.7116911 14.03 2.35 72 1 43.3 4.7 0.9 32.0 4.4 -58.6 4.4 11.029 10.444 10.214 · · · · · · · · · · · · · · · UPM1905+5211 286.4065989 +52.1882172 14.13 3.08 86 0 43.3 3.7 1.1 103.5 3.2 -51.5 3.2 10.973 10.428 10.108 · · · · · · · · · · · · · · · TYC 1431-1353-1 161.6292142 +19.4550617 11.52 2.10 82 0 43.3 8.9 1.1 -32.4 5.5 16.7 5.2 10.187 9.788 9.667 12.584 11.770 12.785 11.543 11.912 GD 194 238.1092675 +18.1723200 15.68 2.84 33 0 43.3 7.8 1.1 -158.8 5.0 118.1 4.9 15.170 15.311 15.278 14.846 14.812 14.670 14.995 15.608 NLTT 49431 307.4543506 +72.7722742 13.79 3.01 89 1 43.2 4.5 2.4 291.3 3.3 -45.4 3.3 · · · · · · · · · · · · · · · · · · · · · · · · LSPM J0253+6321 43.3162292 +63.3513972 15.38 2.34 52 0 43.2 6.3 1.6 174.4 4.9 -106.1 4.8 11.947 11.394 11.071 · · · · · · · · · · · · · · · UPM0423+3821 65.8137136 +38.3527800 15.27 2.35 41 0 43.2 7.3 3.2 61.2 5.6 -9.3 5.5 12.501 11.907 11.669 · · · · · · · · · · · · · · · a 2MASS J04281427+3341439 67.0601500 +33.6948192 13.58 2.37 75 1 43.2 5.4 1.4 153.1 4.0 -176.0 3.8 10.941 10.380 10.158 · · · · · · · · · · · · · · · UPM2012+2605 303.1060536 +26.0965678 13.62 2.68 51 0 43.2 4.1 1.8 -97.5 4.1 16.1 4.1 10.919 10.368 10.123 16.816 15.072 15.786 14.354 12.964 TYC 1273-9-1 66.8540881 +20.3790244 10.97 2.22 54 0 43.2 5.3 1.9 -86.5 6.6 -0.8 6.5 8.769 8.190 7.982 13.564 11.977 12.829 11.371 12.088 LHS 2652 194.0834503 +65.0608431 14.46 3.06 73 0 43.1 3.9 0.8 -504.8 3.0 5.7 3.0 · · · · · · · · · · · · · · · · · · · · · · · · G 244-32 25.6126622 +61.0416139 14.04 2.29 86 0 43.1 4.0 1.9 244.8 3.1 -213.2 3.1 · · · · · · · · · · · · · · · · · · · · · · · · UPM0814+3816 123.7308975 +38.2749969 12.96 2.36 95 1 43.1 4.9 1.0 -10.0 4.1 -159.2 3.8 10.520 9.940 9.663 16.094 14.408 15.111 13.789 12.488 Wolf 1174 332.3850561 +31.6053006 13.10 2.13 51 0 43.1 6.8 1.1 -107.9 3.6 -131.0 3.6 10.756 10.147 9.947 15.724 14.230 14.974 13.617 12.513 2MASS J06033461+1651457 90.8937661 +16.8626000 12.25 2.29 73 5 43.1 4.9 1.4 -90.2 3.9 -15.5 3.7 9.387 8.822 8.572 15.464 13.790 14.558 13.145 11.620 TYC 311-1309-1 205.0572747 +04.8479886 10.28 3.01 67 0 43.1 9.6 1.2 -108.5 6.7 -18.0 6.5 9.131 8.784 8.709 11.126 10.407 10.742 10.177 10.071 a UPM0405+3719 61.4446286 +37.3282592 14.01 2.37 83 1 43.0 4.0 1.7 93.0 3.4 -63.7 3.4 10.915 10.341 10.042 · · · · · · · · · · · · · · · UPM0016+2709 4.1438789 +27.1606442 14.98 2.09 33 0 43.0 7.8 1.0 72.6 5.2 -4.5 5.2 11.802 11.206 10.930 · · · · · · · · · · · · · · · UPM1029+2545 157.4354592 +25.7600658 13.13 2.24 77 0 43.0 6.4 1.1 81.0 4.5 -71.1 4.5 10.358 9.801 9.540 16.389 14.680 15.231 14.022 12.480 UPM0148+1918 27.1537989 +19.3093894 13.70 2.19 46 1 43.0 7.8 0.9 80.5 4.7 -83.1 4.5 10.970 10.397 10.176 16.589 15.054 15.748 14.418 13.078 UPM0416+1851 64.0153928 +18.8590819 12.79 2.31 71 1 43.0 4.5 1.9 112.1 3.5 -34.2 3.4 10.247 9.654 9.410 15.556 14.063 14.755 13.489 12.238 G 137-55 237.2102611 +17.8490736 11.85 3.04 104 0 43.0 4.9 0.9 -214.7 3.3 127.4 3.3 9.821 9.202 8.992 14.338 12.900 13.619 12.247 11.453 UPM2017+1202 304.3594128 +12.0356031 12.38 2.60 55 0 43.0 5.0 1.1 118.9 5.9 50.3 5.8 10.069 9.442 9.248 15.153 13.577 14.353 12.964 11.797 UPM1821+0547 275.3366664 +05.7970122 12.47 3.03 59 3 43.0 10.1 1.5 -8.0 3.8 -3.5 3.4 10.665 10.140 10.003 14.008 12.892 13.411 12.492 12.093 a LHS 2588 189.1715797 +54.9068883 12.99 3.07 143 0 42.9 3.3 1.0 -499.1 2.6 -143.6 2.6 · · · · · · · · · 16.321 14.614 15.382 14.005 12.648 UPM2308+4839 347.1584119 +48.6501169 13.85 2.19 72 0 42.9 6.2 1.3 104.6 4.3 1.9 4.3 10.976 10.409 10.128 · · · · · · · · · · · · · · · UPM0704+4602 106.0965375 +46.0463075 13.23 2.40 122 0 42.9 3.6 1.0 89.0 3.2 22.7 2.9 10.609 9.990 9.723 16.500 14.845 15.596 14.258 12.785 UPM2022+3541 305.5219589 +35.6997567 13.93 2.02 58 2 42.9 4.9 1.7 102.7 4.3 9.7 4.4 11.021 10.470 10.175 17.145 15.684 16.282 14.905 13.274 UPM1710+3531 257.7267478 +35.5197447 9.59 2.11 67 0 42.9 9.7 1.1 0.9 5.1 -46.0 5.2 8.179 7.875 7.814 10.073 9.715 10.225 9.674 9.110 a 2MASS J02211590+3338502 35.3157211 +33.6468075 11.66 2.34 86 3 42.9 3.8 1.1 -104.4 3.5 -105.5 3.4 9.353 8.755 8.527 14.493 12.958 13.716 12.388 11.212 UPM1343+2130 205.8168450 +21.5007319 14.10 2.98 59 0 42.9 5.7 1.1 111.4 4.2 -101.6 4.1 11.214 10.563 10.314 17.426 15.676 16.453 15.038 13.450 UPM1153+1118 178.4860142 +11.3060203 13.18 2.94 68 0 42.9 8.9 1.1 -29.4 5.0 2.0 4.6 12.027 11.713 11.666 13.901 13.264 13.530 13.141 12.906 a NLTT 41105 235.5024475 +75.2674883 15.78 3.06 66 0 42.8 9.6 0.6 -132.0 5.1 112.9 5.1 12.450 11.867 11.533 · · · · · · · · · · · · · · · UPM1738+6509 264.5206925 +65.1571333 13.21 3.07 130 0 42.8 4.9 0.8 47.7 2.8 -97.2 2.9 10.566 9.993 9.734 16.729 14.916 15.841 14.273 12.642 UPM1953+4217 298.3507014 +42.2902794 12.34 3.03 85 0 42.8 3.5 1.5 -101.4 3.0 62.5 2.9 10.000 9.446 9.216 15.008 13.550 14.096 12.885 11.809 UPM0753+2822 118.4444722 +28.3681439 15.75 2.36 38 0 42.8 8.0 1.0 26.5 6.6 21.8 5.9 12.595 12.013 11.740 · · · · · · · · · · · · · · · UPM1903+2134 285.7980625 +21.5802406 11.34 3.05 75 1 42.8 5.5 1.3 15.7 3.5 -15.4 3.5 10.281 9.706 9.470 · · · · · · · · · · · · · · · c a UPM2351+7232 357.9868194 +72.5345075 15.76 2.33 39 0 42.7 7.0 1.6 35.0 5.2 17.0 5.3 13.326 12.690 12.492 · · · · · · · · · · · · · · · a UPM1740+6653 265.0548903 +66.8929381 14.17 3.09 104 0 42.7 5.2 0.8 79.5 2.9 89.8 2.9 11.528 11.009 10.722 · · · · · · · · · · · · · · · UPM1952+6022 298.1021483 +60.3702075 12.22 3.05 129 1 42.7 3.6 1.1 26.2 2.7 -121.3 2.6 9.791 9.213 9.018 15.305 13.729 14.455 13.128 11.828 UPM0452+5311 73.0406714 +53.1844289 10.12 2.26 75 1 42.7 6.4 2.1 -117.5 5.3 14.4 5.3 8.168 7.523 7.316 12.647 11.152 11.930 10.563 9.749 UPM2024+4337 306.2042750 +43.6264361 15.44 2.26 38 0 42.7 7.2 1.6 11.7 4.7 -3.7 4.3 9.456 7.836 7.101 · · · · · · · · · · · · · · · UPM2014+3943 303.7312797 +39.7236547 13.31 2.94 73 0 42.7 4.6 1.7 -3.4 3.4 -127.0 3.4 10.297 9.743 9.457 · · · · · · · · · · · · · · · BD+04 3199 247.9646553 +04.2006208 10.41 3.02 67 0 42.7 8.9 0.9 -22.1 5.3 51.7 4.9 8.927 8.569 8.519 10.948 10.223 10.539 10.010 9.840 a UPM2337+8157 354.3615786 +81.9535664 13.93 2.19 71 1 42.6 6.4 1.0 144.9 7.0 26.6 6.8 11.064 10.551 10.228 17.016 15.408 16.127 14.860 13.312 2MASS J03224269+7932066 50.6798719 +79.5345633 13.83 2.29 104 0 42.6 4.3 1.1 90.3 3.9 -165.9 3.9 11.040 10.491 10.220 17.120 15.529 16.341 14.913 13.239 2MASS J01000443+5554341 15.0161700 +55.9096744 16.04 2.29 31 0 42.6 7.3 1.1 -331.1 6.2 52.7 6.2 · · · · · · · · · · · · · · · · · · · · · · · · UPM2353+5139 358.2934211 +51.6590339 16.42 2.00 30 0 42.6 6.7 1.1 -13.5 6.6 -7.3 6.4 14.624 14.242 14.128 · · · · · · · · · · · · · · · UPM1650+5055 252.5384997 +50.9322425 9.93 2.11 69 2 42.6 7.8 1.0 10.4 5.4 21.6 5.2 6.749 5.884 5.558 13.717 12.273 12.941 11.520 9.321 a UPM1054+3544 163.7046625 +35.7453022 11.13 2.24 97 0 42.6 6.9 1.3 116.2 4.8 -74.2 4.7 9.024 8.347 8.137 · · · · · · · · · · · · · · · c 2MASS J20351947+3248443 308.8301733 +32.8128269 12.26 2.70 72 0 42.6 3.7 1.7 -188.8 3.4 117.3 3.3 9.949 9.410 9.134 15.140 13.522 14.331 12.950 11.822 2MASS J08115849+2946293 122.9942847 +29.7741072 13.21 2.38 96 3 42.6 4.5 1.1 122.4 3.7 -154.6 3.3 10.593 10.003 9.765 16.325 14.667 15.442 14.050 12.648 LHS 2529 183.4965817 +29.5746342 13.42 2.99 102 1 42.6 5.8 1.4 -326.2 3.5 -408.3 3.1 · · · · · · · · · 16.530 14.944 15.635 14.394 12.878 LP 430-10 155.4791853 +19.1467125 12.54 2.20 95 1 42.6 6.2 1.1 179.6 3.9 -106.0 3.6 10.360 9.752 9.530 15.266 13.772 14.479 13.162 12.103 UPM1506+1735 226.6410314 +17.5923081 13.31 3.08 123 0 42.6 4.5 1.3 -99.8 2.6 55.8 2.5 10.529 9.975 9.715 16.525 14.832 15.607 14.278 12.747 UPM1304+8611 196.0854853 +86.1937469 15.80 3.02 34 1 42.5 7.3 1.2 40.1 8.6 -33.4 8.4 12.864 12.267 12.060 · · · · · · · · · · · · · · · a LHS 2610 190.5924883 +77.8908883 14.06 3.05 119 1 42.5 4.1 0.8 -646.6 3.9 474.9 3.8 · · · · · · · · · 17.980 15.790 16.629 15.182 13.434 UPM2150+5927 327.7459225 +59.4607114 11.35 2.33 91 1 42.5 5.7 1.9 3.2 4.8 -5.8 4.7 6.933 5.842 5.324 16.758 14.445 15.620 13.202 10.486 a UPM0013+5236 3.3707536 +52.6159619 15.06 2.21 50 0 42.5 5.3 1.3 1.5 3.8 5.5 3.9 13.905 13.606 13.616 · · · · · · · · · · · · · · · UPM0332+4914 53.0604867 +49.2350475 14.06 2.35 105 1 42.5 4.0 1.4 27.3 3.6 -63.3 3.6 11.348 10.753 10.512 · · · · · · · · · · · · · · ·

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

UPM2149+4751 327.2862925 +47.8635306 16.03 2.34 32 0 42.5 7.1 1.4 -18.0 5.3 40.3 5.0 13.020 12.451 12.208 · · · · · · · · · · · · · · · G 203-55 258.9657947 +47.6308106 13.36 3.07 91 0 42.5 4.1 1.0 46.9 2.6 -298.0 2.6 · · · · · · · · · 16.664 14.976 15.674 14.338 12.883 UPM2057+2841 314.3146517 +28.6976375 13.53 2.06 45 0 42.5 5.9 1.5 97.8 5.0 -114.7 5.0 10.542 9.974 9.685 · · · · · · · · · · · · · · · TYC 1291-690-1 79.2073925 +19.7209922 11.61 2.18 44 0 42.5 5.6 1.6 23.5 8.6 10.3 8.4 10.617 10.546 10.466 11.705 11.394 11.520 11.349 11.349 UPM1006+1817 151.6602056 +18.2900850 13.68 2.24 72 0 42.5 7.7 0.8 -46.3 4.2 -66.7 4.2 10.981 10.391 10.133 16.747 15.145 15.896 14.544 13.446 UPM1234+1132 188.7067344 +11.5446658 14.08 2.95 60 0 42.5 9.8 1.2 -26.2 5.3 14.1 3.9 12.737 12.338 12.264 14.972 14.146 14.516 13.928 13.722 NLTT 57355 353.9335433 +73.9044867 14.47 2.28 62 0 42.4 6.5 1.6 -57.9 4.4 213.4 4.3 11.186 10.602 10.298 · · · · · · · · · · · · · · · G 199-69 201.3482381 +57.9674547 12.56 3.08 142 2 42.4 3.5 1.0 -27.8 2.6 296.2 2.5 · · · · · · · · · 15.876 14.051 14.942 13.472 12.255 UPM0722+5542 110.7442336 +55.7045900 15.17 2.38 57 1 42.4 5.8 1.0 -52.7 5.1 2.0 4.5 11.859 11.295 10.984 · · · · · · · · · · · · · · · UPM0025+5450 6.4552017 +54.8398197 14.69 2.21 67 3 42.4 5.1 1.2 5.3 3.9 11.2 3.8 13.784 13.652 13.603 15.069 14.582 14.750 14.503 14.362 UPM0433+4149 68.2574342 +41.8285222 14.12 2.37 80 2 42.4 4.1 1.6 42.2 3.5 38.2 3.5 11.273 10.688 10.413 · · · · · · · · · · · · · · · 2MASS J07473990+2035378 116.9159614 +20.5939886 12.92 2.34 81 0 42.4 4.3 0.8 -64.9 3.6 24.8 3.6 10.299 9.734 9.492 15.965 14.369 15.147 13.717 12.977 UPM1049+1756 162.3949908 +17.9431428 14.12 2.10 71 0 42.4 9.1 1.2 -79.7 5.5 -45.8 5.4 11.873 11.187 11.000 16.636 15.197 16.047 14.615 13.697 UPM0950+1121 147.7315256 +11.3652133 12.68 2.94 72 1 42.4 10.1 1.0 0.2 8.3 -14.7 8.2 11.215 10.800 10.692 13.770 12.855 13.292 12.551 12.300 a G 245-78 54.4879494 +77.7691003 13.44 2.38 104 1 42.3 3.9 1.1 345.5 3.6 70.4 3.6 · · · · · · · · · 16.486 14.872 15.655 14.295 12.894 LHS 2191 146.9947022 +60.2560519 11.42 2.38 110 3 42.3 4.8 0.8 -861.6 5.2 -211.6 5.2 · · · · · · · · · · · · · · · · · · · · · · · · UPM1904+2801 286.0838103 +28.0316225 8.32 3.06 63 1 42.3 6.9 1.3 9.5 4.6 11.3 4.4 6.584 5.663 5.284 · · · · · · · · · · · · · · · c a UPM1602+1937 240.7452483 +19.6222925 12.80 3.04 108 1 42.3 4.6 1.0 -97.4 2.8 38.6 2.8 10.233 9.653 9.393 15.784 14.297 15.000 13.719 12.337 G 265-29 98.5968528 +86.4702911 13.54 1.54 56 1 42.2 5.7 1.1 -53.5 9.5 -287.9 9.5 · · · · · · · · · 16.413 14.817 15.541 14.141 12.898 UPM0023+6114 5.7562056 +61.2381664 13.76 2.21 72 0 42.2 7.1 1.4 8.1 5.2 3.2 5.2 12.546 12.273 12.220 14.670 13.931 14.321 13.745 13.521 UPM1025+4750 156.4065383 +47.8380544 12.45 2.32 143 3 42.2 3.1 1.2 49.1 2.9 18.4 3.0 9.955 9.418 9.160 15.568 13.935 14.690 13.351 11.960 LP 295-636 18.2314853 +27.7477083 14.48 2.19 39 0 42.2 5.2 1.0 152.3 4.1 -214.2 4.1 · · · · · · · · · 17.356 15.744 16.501 15.086 13.701 G 88-45 115.1195222 +19.9309536 13.86 2.29 69 3 42.2 4.3 0.9 -275.0 3.4 -275.6 3.2 · · · · · · · · · · · · · · · · · · · · · · · · TYC 981-129-1 258.0124325 +10.2704581 12.02 3.03 82 2 42.2 8.9 1.0 8.7 4.4 7.0 4.5 10.742 10.299 10.198 13.194 12.341 12.719 12.118 11.883 UPM1639+8320 249.8398400 +83.3336433 15.49 3.03 64 1 42.1 7.5 0.9 -1.4 5.7 131.7 5.8 12.453 11.867 11.587 · · · · · · · · · · · · · · · G 242-28 349.0726575 +72.7178264 13.27 2.31 82 0 42.1 5.4 1.5 279.2 3.6 26.2 3.5 · · · · · · · · · · · · · · · · · · · · · · · · 2MASS J15290296+4646240 232.2616325 +46.7732303 12.89 3.06 128 1 42.1 4.0 1.0 -119.6 2.9 -31.2 2.8 9.942 9.406 9.114 · · · · · · · · · · · · · · · UPM2332+4125 353.0790225 +41.4166822 14.10 2.20 67 0 42.1 5.6 1.1 68.5 3.8 -32.9 3.9 11.175 10.596 10.326 · · · · · · · · · · · · · · · UPM1704+1405 256.1865125 +14.0892842 11.50 3.06 71 0 42.1 9.7 1.0 -3.4 4.8 5.2 4.7 10.422 10.183 10.127 11.960 11.468 11.660 11.356 11.218 a UPM1116-0602 169.2155903 -06.0417525 13.36 1.93 32 1 42.1 7.7 1.4 -20.1 8.0 21.8 8.0 12.048 11.811 11.771 13.671 13.125 13.343 13.015 12.909 a G 194-23 124.8927444 +57.5996781 11.97 2.42 135 4 42.0 4.2 1.1 -318.2 3.5 -220.9 3.1 · · · · · · · · · 14.702 13.186 13.967 12.579 11.537 UPM0946+4838 146.5828108 +48.6395928 11.56 2.95 110 1 42.0 3.4 1.1 7.2 3.4 -0.6 3.4 9.173 8.528 8.345 14.606 12.995 13.779 12.410 11.147 LHS 5388 337.3149772 +43.3338472 13.72 2.15 96 0 42.0 5.8 1.3 243.6 3.8 395.7 3.8 · · · · · · · · · 17.005 15.285 16.051 14.633 13.125 NLTT 52908 331.4417775 +37.5000728 15.01 2.11 44 0 42.0 6.6 0.9 225.6 4.4 -123.4 4.4 · · · · · · · · · · · · · · · · · · · · · · · · UPM0410+3332 62.6444150 +33.5357531 12.80 2.37 92 0 42.0 5.5 1.1 34.8 4.4 -56.2 4.1 10.734 10.139 9.910 15.450 13.971 14.690 13.336 12.382 UPM1029+3200 157.3338517 +32.0086931 9.40 2.12 60 1 42.0 10.0 1.1 -272.5 6.8 44.8 6.7 · · · · · · · · · · · · · · · · · · · · · · · · UPM2125+2130 321.2909139 +21.5129067 12.49 2.01 48 0 42.0 7.5 1.0 78.8 5.2 -17.9 5.2 10.216 9.605 9.387 15.092 13.575 14.325 12.956 11.915 a UPM1122+2106 170.7218108 +21.1093569 14.50 2.06 48 0 42.0 6.8 1.1 17.4 4.3 -45.6 4.4 13.013 12.513 12.466 15.483 14.731 15.088 14.402 14.131 a G 150-49 208.4734278 +19.0224972 12.54 2.97 112 2 42.0 4.6 1.4 135.5 3.0 -268.3 2.9 · · · · · · · · · 15.541 13.973 14.690 13.353 12.075 G 137-45 236.0973022 +15.0951667 12.94 3.03 105 0 42.0 5.0 1.1 -345.0 3.2 -124.3 3.2 · · · · · · · · · 16.161 14.420 15.224 13.797 12.415 NLTT 1303 6.3149267 +62.4167981 15.18 2.21 48 0 41.9 5.1 1.4 381.4 4.3 -87.9 4.3 · · · · · · · · · · · · · · · · · · · · · · · · UPM0444+4401 71.1545589 +44.0223758 15.86 2.39 42 0 41.9 7.3 1.6 10.2 6.6 -61.7 6.6 12.538 11.979 11.689 · · · · · · · · · · · · · · · a 2MASS J22300541+3930599 337.5228972 +39.5160203 11.90 2.15 82 1 41.9 6.6 1.0 55.9 4.0 -165.3 4.0 9.663 9.074 8.852 14.538 13.022 13.811 12.422 11.415 UPM0104+3753 16.0132297 +37.8964681 11.29 2.30 75 1 41.9 5.2 1.0 3.7 4.2 25.3 4.2 9.050 8.430 8.237 14.093 12.449 13.249 11.842 10.804 TYC 2500-629-1 141.8261172 +36.4859406 10.43 2.34 65 0 41.9 5.3 1.1 -93.4 4.1 -31.4 4.1 9.096 8.657 8.555 11.741 10.818 11.253 10.489 10.184 UPM0348+3046 57.1067619 +30.7741356 13.40 2.37 73 1 41.9 6.5 1.6 4.3 4.6 3.9 3.9 11.759 11.347 11.249 14.960 13.938 14.429 13.545 13.074 a Wolf 527 210.3583414 +19.8039856 10.92 2.97 93 0 41.9 5.7 1.1 -286.5 3.9 273.5 3.9 · · · · · · · · · 13.258 11.828 12.557 11.202 10.502 UPM1544+1911 236.1713767 +19.1918564 11.41 3.04 126 3 41.9 4.6 1.1 -3.4 3.2 18.4 3.2 9.487 8.846 8.640 13.624 12.235 12.961 11.649 11.006 a 2MASS J01025097+1856543 15.7128522 +18.9481408 12.44 2.11 51 0 41.9 7.9 0.9 90.3 5.0 -62.2 5.0 9.514 8.923 8.669 15.582 14.083 14.783 13.463 11.814 UPM1721+1315 260.3708983 +13.2569075 12.12 3.03 83 0 41.9 10.1 0.9 -2.0 4.4 1.9 4.2 10.300 9.639 9.485 14.015 12.736 13.335 12.319 11.878 a LHS 6062 56.2093100 +81.8898194 15.36 2.26 52 0 41.8 6.7 1.3 231.1 7.7 -390.3 7.4 · · · · · · · · · · · · · · · · · · · · · · · · NLTT 55904 346.8011411 +72.2960317 14.31 2.35 86 0 41.8 5.2 1.4 194.0 3.5 -55.6 3.4 11.455 10.885 10.597 · · · · · · · · · · · · · · · LP 301-82 62.6812814 +32.9343606 11.13 2.37 70 0 41.8 5.8 1.1 141.4 5.1 -87.7 4.5 9.313 8.612 8.471 13.469 12.040 12.798 11.435 10.749 2MASS J14114799+2116160 212.9493944 +21.2709269 12.04 3.03 127 0 41.8 4.1 1.1 -137.5 2.8 -45.6 2.6 9.528 8.859 8.630 15.107 13.562 14.223 12.962 11.585 2MASS J20033208+1508317 300.8842381 +15.1425675 14.73 1.93 30 0 41.8 5.7 1.8 154.8 7.5 114.4 7.4 11.609 11.021 10.792 · · · · · · · · · · · · · · · UPM1105+1135 166.4828875 +11.5836053 13.53 2.92 69 0 41.8 7.0 1.1 -17.2 3.8 -0.0 3.3 12.507 12.312 12.242 13.983 13.549 13.694 13.439 13.524 a UPM1344+5528 206.2419475 +55.4726633 13.61 3.08 139 2 41.7 4.5 0.9 111.5 3.1 -28.7 3.0 10.878 10.267 10.003 17.383 15.486 16.282 14.822 13.187 UPM0124+5307 21.1026369 +53.1316478 13.56 2.32 105 2 41.7 3.6 1.4 123.1 2.8 15.8 2.8 10.922 10.290 10.024 · · · · · · · · · · · · · · · StKM 2-388a 72.6061739 +19.9859253 11.29 2.18 58 2 41.7 4.8 1.4 36.2 5.3 -146.1 5.2 8.731 8.094 7.911 13.482 11.975 12.753 11.365 10.442 UPM0516+1943 79.2416864 +19.7317489 12.06 2.18 47 0 41.7 5.6 1.6 12.1 6.7 10.6 6.6 10.664 10.379 10.251 13.006 12.250 12.617 11.991 11.736 NLTT 31434 189.8937369 +19.7069619 13.85 2.98 70 0 41.7 8.8 1.0 -142.8 4.7 -173.1 4.0 11.302 10.785 10.567 16.666 15.119 15.809 14.556 13.200 UPM0958+0731 149.7230361 +07.5251269 12.30 2.94 57 1 41.7 7.1 1.2 -23.9 7.1 -25.6 6.9 11.025 10.716 10.615 13.039 12.303 12.613 12.113 11.958 a 2MASS J12364143+6531176 189.1737683 +65.5215850 12.48 3.06 163 3 41.6 2.8 0.9 108.4 2.3 22.2 2.3 9.810 9.247 8.970 15.961 14.112 15.004 13.478 11.878 UPM1641+5510 250.4663331 +55.1728956 11.41 3.07 123 1 41.6 5.3 0.9 24.2 2.5 0.4 2.4 9.008 8.374 8.165 14.554 12.848 13.722 12.228 11.072

Table 4—Continued

name R.A. decl. Umag epdiff obs. rej. Π(abs) Π err Π(corr) PMRA error PMDC error J H Ks B V g r i notes [deg] [deg] [mag] [years] [num] [num] [mas] [mas] [mas] [mas/y] [mas/y] [mas/y] [mas/y] mag mag mag mag mag mag mag mag

UPM2012+3504 303.1447833 +35.0781706 12.01 2.94 88 1 41.6 5.2 1.5 -3.4 4.1 -7.4 4.1 6.881 5.698 5.190 · · · · · · · · · · · · · · · a UPM1526+3305 231.5968872 +33.0913203 14.66 2.88 66 1 41.6 5.6 1.1 -113.0 4.6 -68.1 4.2 11.383 10.828 10.520 · · · · · · · · · · · · · · · UPM0317+3211 49.4230603 +32.1833542 11.77 2.35 75 0 41.6 6.2 1.5 17.8 4.8 7.4 4.7 10.487 10.251 10.158 12.720 11.971 12.339 11.749 11.483 a UPM1950+8719 297.6655422 +87.3284489 13.92 3.02 83 0 41.5 4.9 1.0 -63.0 5.5 30.6 5.8 11.580 10.919 10.694 16.881 15.255 15.979 14.613 13.393 LHS 2315 162.3003350 +33.5308750 15.11 2.11 43 0 41.5 7.5 1.2 -402.4 6.2 -446.3 6.0 · · · · · · · · · · · · · · · · · · · · · · · · LP 294-24 14.3594219 +29.5430886 14.74 2.19 34 0 41.5 7.5 1.0 237.5 5.8 21.5 5.8 · · · · · · · · · · · · · · · · · · · · · · · · UPM1957+2716 299.4495364 +27.2731117 15.33 2.25 31 0 41.5 6.8 1.3 97.8 6.9 78.8 6.8 11.714 11.057 10.801 · · · · · · · · · · · · · · · c UPM0220+1748 35.0895000 +17.8089319 13.79 2.15 49 1 41.5 7.4 1.2 3.2 3.6 -22.1 3.5 12.503 12.238 12.170 14.207 13.699 13.880 13.547 13.430 UPM1304+1744 196.1941703 +17.7381531 13.88 2.98 79 0 41.5 8.1 1.2 -51.9 5.2 17.2 4.2 11.118 10.548 10.295 17.012 15.336 16.097 14.861 13.253 UPM0835+1654 128.8171119 +16.9009742 13.66 2.28 46 0 41.5 7.3 1.0 2.2 5.5 18.1 4.1 11.195 10.589 10.328 16.284 14.769 15.510 14.158 13.092 UPM1228+0750 187.0173414 +07.8464317 11.99 3.04 97 2 41.5 9.1 1.2 -125.5 5.4 6.2 4.1 10.449 9.887 9.726 13.681 12.570 13.104 12.118 11.754 G 66-17 219.5007894 +05.2801378 12.89 3.09 73 0 41.5 6.1 1.1 -278.2 4.4 -320.0 4.4 · · · · · · · · · 15.808 14.306 14.959 13.729 12.316 2MASS J16494311-0230135 252.4302158 -02.5039289 12.30 2.12 69 0 41.5 7.1 1.4 142.4 3.9 -42.1 3.8 9.804 9.227 8.946 15.156 13.669 14.346 12.985 11.793 UPM0652+7909 103.1076767 +79.1600317 14.40 2.40 94 0 41.4 5.2 1.1 5.6 4.7 -130.7 4.3 11.092 10.563 10.245 · · · · · · · · · · · · · · · NLTT 16224 94.0301475 +71.2546644 13.95 2.33 110 0 41.4 3.9 0.9 255.1 3.2 -119.6 2.9 · · · · · · · · · 17.378 15.701 16.528 15.086 13.367 UPM1029+5548 157.4719961 +55.8066308 14.54 2.78 57 0 41.4 4.5 1.0 -55.9 4.5 70.2 4.3 11.449 10.902 10.598 · · · · · · · · · · · · · · · LP 198-291 48.3450631 +44.2188900 15.15 2.34 58 0 41.4 5.4 1.1 -43.6 4.6 -213.7 4.5 · · · · · · · · · · · · · · · · · · · · · · · · UPM1922+4132 290.5652044 +41.5495817 15.87 2.30 33 0 41.4 6.6 1.3 105.2 5.2 -96.7 5.2 12.520 11.951 11.690 · · · 17.527 · · · · · · 15.190 LP 300-43 57.2275175 +29.2311519 14.57 2.35 46 0 41.4 7.7 1.1 100.8 4.9 -175.4 4.3 11.609 11.052 10.797 · · · · · · · · · · · · · · · 2MASS J09005207+0643315 135.2163414 +06.7256211 12.85 2.31 38 0 41.4 7.6 1.1 -157.5 5.5 56.9 4.7 10.600 9.998 9.796 15.191 13.659 14.435 13.034 12.243 G 253-25 141.6893306 +79.2419639 11.67 2.40 162 1 41.3 4.2 1.3 321.6 4.8 -124.6 4.7 · · · · · · · · · 14.351 12.787 13.628 12.196 11.341 UPM1301+6708 195.4492689 +67.1427581 13.74 3.06 132 0 41.3 4.7 0.8 -6.5 3.3 52.5 3.1 11.042 10.478 10.163 17.154 15.453 16.286 14.881 13.165 Wolf 312 128.1491758 +45.1712547 11.15 2.39 101 1 41.3 4.3 1.0 -135.7 3.7 -62.7 3.7 8.880 8.335 8.084 13.891 12.411 13.097 11.796 10.781 2MASS J15450528+1859291 236.2713692 +18.9914450 11.72 3.04 120 6 41.3 4.3 1.1 -141.1 2.7 2.0 2.7 9.335 8.759 8.551 14.546 13.096 13.769 12.482 11.243 TYC 835-692-1 149.6153167 +13.3217408 11.75 2.08 69 0 41.3 9.0 1.0 10.3 7.9 -24.7 7.7 10.407 9.990 9.892 12.737 11.882 12.243 11.609 11.293 a 2MASS J20083460+8432596 302.1429517 +84.5505675 15.14 2.05 62 0 41.2 5.6 0.9 -39.2 6.9 161.6 6.7 12.305 11.745 11.477 · · · · · · · · · · · · · · · LP 31-307 62.7531083 +73.0394942 14.33 2.34 62 1 41.2 6.0 0.8 235.1 5.3 -268.5 5.1 · · · · · · · · · 17.327 15.834 16.790 15.339 13.628 2MASS J01020515+5254146 15.5206833 +52.9037969 12.14 2.32 133 0 41.2 3.3 1.1 -115.9 2.6 -71.0 2.6 9.739 9.213 8.929 15.272 13.563 14.326 12.939 11.581 LHS 6247 199.1197042 +40.1204236 13.18 3.09 112 0 41.2 3.9 1.2 287.2 2.8 -325.8 2.8 · · · · · · · · · 16.599 14.774 15.543 14.142 12.714 UPM2253+2731 343.3645150 +27.5209631 12.22 2.18 57 1 41.2 7.7 1.0 -40.0 3.9 -49.2 3.7 10.645 10.131 10.020 13.553 12.564 13.039 12.186 11.826 LP 351-43 21.0642219 +25.5390700 12.90 2.29 64 0 41.2 6.7 1.0 201.4 5.0 -4.6 5.0 10.519 9.885 9.633 15.716 14.127 14.898 13.566 12.367 UPM1306+1333 196.5431011 +13.5597506 13.18 2.97 96 1 41.2 8.4 1.1 -81.2 5.2 -17.2 4.1 10.689 10.123 9.882 16.154 14.573 15.323 13.985 12.692 NLTT 14784 79.0649517 +05.7984086 14.27 2.18 36 0 41.2 7.7 0.9 240.4 6.2 234.7 6.1 · · · · · · · · · 17.209 15.745 16.459 15.094 13.477 LHS 3214 248.5555544 +54.3965500 10.76 3.07 128 0 41.1 4.5 1.0 -241.4 2.4 538.4 2.4 · · · · · · · · · 13.378 11.856 12.590 11.227 10.474 LHS 2044 130.8609514 +45.0325569 13.73 2.36 86 1 41.1 4.1 1.1 456.0 3.7 -192.9 3.6 · · · · · · · · · 17.405 15.511 16.137 14.788 13.247 UPM2310+4318 347.6183656 +43.3057436 14.47 2.20 64 0 41.1 7.1 1.1 38.7 4.4 -2.9 4.4 11.323 10.808 10.505 · · · · · · · · · · · · · · · a UPM1811+3913 272.8340064 +39.2179644 15.56 2.98 31 0 41.1 7.6 0.9 -56.9 4.8 44.3 4.8 12.846 12.341 12.074 · · · · · · · · · · · · · · · Wolf 1505 14.8723506 +31.1383331 12.89 2.30 85 0 41.1 6.1 0.9 442.5 4.8 -70.5 4.8 · · · · · · · · · 15.642 14.125 14.933 13.526 12.377 UPM2100+1523 315.1263706 +15.3873783 14.11 1.96 35 0 41.1 5.4 0.7 83.5 4.2 18.7 4.2 10.939 10.414 10.183 17.200 15.590 16.468 14.877 13.125 UPM0609+6808 92.3829347 +68.1412550 12.30 2.38 138 0 41.0 4.3 0.9 -32.9 3.7 30.6 3.5 9.944 9.400 9.147 15.291 13.676 14.507 13.070 11.884 UPM1602+5758 240.6748222 +57.9711339 14.39 3.05 70 0 41.0 5.0 1.0 -10.8 2.9 54.2 2.9 14.129 14.299 14.221 13.985 13.748 13.780 13.951 14.164 BD+41 1708 115.6765728 +41.5049828 9.70 2.35 49 0 41.0 7.8 1.0 -27.4 8.2 -139.6 8.2 8.432 8.062 7.985 10.691 9.895 10.430 9.675 9.422 LP 353-57 36.2343786 +24.8706397 14.75 2.25 54 1 41.0 5.7 1.0 258.7 3.4 -77.4 3.4 · · · · · · · · · · · · · · · · · · · · · · · · UPM0626+2032 96.6419828 +20.5371914 13.27 2.30 63 0 41.0 5.0 1.0 -8.6 4.0 -35.9 4.0 10.434 9.861 9.569 1.668 1.493 1.568 1.422 1.260 LP 666-28 136.3901433 -06.0902361 12.21 1.97 60 0 41.0 7.3 0.9 8.0 8.3 -191.1 8.2 · · · · · · · · · 15.016 13.473 14.240 12.874 11.652 a 2MASS J15075723+7613590 226.9863133 +76.2337403 11.93 3.04 226 1 40.8 4.5 0.8 -133.6 2.5 163.1 2.4 9.235 8.638 8.368 15.570 13.764 14.746 13.238 11.614

a visual inspection of the fit shows scatter indicating the solution might be erroneous

b visual inspection of the sky image shows an elongated or blended image indicating the solution might be erroneous

c no correction so mean of 1.3 mas used to convert from relative to absolute parallax

d arge correction so cut off of 3.9 mas used to convert from relative to absolute parallax