arXiv:1601.05578v1 [nucl-ex] 21 Jan 2016

Search for double beta decay of^{116}Cd with enriched 116CdWO_4 crystal scintillators (Aurora experiment)

F. A. Danevich^1, A. S. Barabash^2, P. Belli^{3,4}, R. Bernabei^{3,4}, F. Cappella^5, V. Caracciolo^5, R. Cerulli^5, D. M. Chernyak^1, S. d’Angelo^{3,4,6}, A. Incicchitti^{7,8}, V. V. Kobychev^1, S. I. Konovalov^2, M. Laubenstein^5, V. M. Mokina^{1,7}, D. V. Poda^{1,9}, O. G. Polischuk^1, V. N. Shlegel^{10}, V. I. Tretyak^{1,7} and V. I. Umatov^2

1 Institute for Nuclear Research, MSP 03680 Kyiv, Ukraine 2 National Research Centre “Kurchatov Institute”, Institute of Theoretical and Experimental Physics, 117218 Moscow, Russia 3 INFN, sezione di Roma “Tor Vergata”, I-00133 Rome, Italy 4 Dipartimento di Fisica, Università di Roma “Tor Vergata”, I-00133 Rome, Italy 5 INFN, Laboratori Nazionali del Gran Sasso, I-67100 Assergi (AQ), Italy 7 INFN, sezione di Roma, I-00185 Rome, Italy 8 Dipartimento di Fisica, Università di Roma “La Sapienza”, I-00185 Rome, Italy 9 CSNSM, Univ. Paris-Sud, CNRS/IN2P3, Université Paris-Saclay, 91405 Orsay, France 10 Nikolaev Institute of Inorganic Chemistry, 630090 Novosibirsk, Russia

E-mail: danevich@kinr.kiev.ua

Abstract.

The Aurora experiment to investigate double beta decay of^{116}Cd with the help of 1.162 kg cadmium tungstate crystal scintillators enriched in^{116}Cd to 82% is in progress at the Gran Sasso Underground Laboratory. The half-life of^{116} Cd relatively to the two neutrino double beta decay is measured with the highest up-to-date accuracy T_{1/2} = (2.62 ± 0.14) × 10^{19} yr. The sensitivity of the experiment to the neutrinoless double beta decay of^{116} Cd to the ground state of^{116}Sn is estimated as T_{1/2} ≥ 1.9 × 10^{23} yr at 90% CL, which corresponds to the effective Majorana neutrino mass limit ⟨mν ⟩ ≤ (1.2 − 1.8) eV. New limits are obtained for the double beta decay of^{116} Cd to the excited levels of^{116}Sn, and for the neutrinoless double beta decay with emission of majorons.

1. Introduction Observations of neutrino oscillations give a clear evidence of effects beyond the Standard Model of particles (see, e.g., review [1]) and provide a strong motivation to investigate neutrinoless double beta (0ν2β) decay of atomic nuclei. The 0ν2β decay violates the lepton-number conservation and is only possible if neutrino is a massive Majorana particle. Therefore, search for 0ν2β decay is considered as a promising way to clarify the nature of the neutrino, check the lepton number conservation, determine the absolute scale of the neutrino mass and the neutrino mass hierarchy, test the existence of effects beyond the Standard Model, in particular, existence of

6 Deceased

hypothetical Nambu-Goldstone bosons (majorons) and right-handed currents in weak interaction [2, 3, 4, 5, 6, 7].

The isotope^{116}Cd is one of the most promising 2β nuclei thanks to the favorable theoretical estimations of the decay probability ([2, 3]), large energy release Q_{2β} = 2813.50(13) keV [8], relatively high isotopic abundance δ = 7.49% [9] and a possibility of isotopic enrichment in a large amount.

Experimental investigations of^{116}Cd 2β decay were realized by tracking detectors with enriched cadmium foil as source [10, 11, 12], and by calorimetric approach using CdWO_4 crystal scintillators [13, 14, 15] and CdZnTe room temperature semiconductors [16]. The 2β decay to excited levels of^{116}Sn were also searched for with low background HPGe γ detectors [17, 18]. Large volume radiopure cadmium tungstate crystal scintillators were produced from cadmium enriched in^{116}Cd to 82% (^{116}CdWO_4) to investigate double beta decay of^{116}Cd [19]. The crystals show excellent scintillation properties and low level of radioactive contamination [20, 21]. Preliminary results of the Aurora experiment were reported in the conference proceedings [22, 23]. Here we present recent results of the experiment.

2. Experiment Two^{116}CdWO_4 crystal scintillators with a total mass 1.162 kg (1.584 × 10^{24} of^{116}Cd nuclei) are installed in the low background DAMA/R&D set-up operated at the Gran Sasso Underground Laboratory of I.N.F.N. (Italy). The low background set-up with the^{116}CdWO_4 detectors has been modified several times to improve the energy resolution and to decrease background. In the last configuration of the set-up the^{116}CdWO_4 crystal scintillators are fixed in polytetrafluoroethylene containers filled with ultrapure liquid scintillator. The liquid scintillator improves the light collection from the^{116}CdWO_4 crystal scintillators and serves as an anti-coincidence veto counter. The scintillators are viewed through high purity quartz lightguides (⊘7 × 40 cm) by low background high quantum efficiency photomultiplier tubes (PMT, Hamamatsu R6233MOD). The detectors are installed inside a low radioactive copper box flushed with high pure nitrogen gas with an external shield made of radiopure materials: copper (15 cm), lead (15 cm), cadmium (1.5 mm) and paraffin (4 to 10 cm). The whole set-up is enclosed in a plexiglas box also flushed with high purity nitrogen gas to remove radon. An event-by-event data acquisition system based on a 1 GS/s 8 bit transient digitizer (Acqiris DC270) records time and pulse profile of events. The energy scale and the energy resolution of the detector are checked periodically with^{22}Na,^{60}Co,^{137}Cs, and^{228}Th γ sources. The energy resolution of the 116CdWO_4 detector for 2615 keV γ quanta of^{208}Tl is FWHM ≈ 5%.

3. Results and discussion The energy spectrum of β and γ events accumulated over 12015 h by the^{116}CdWO_4 detectors is presented in Fig. 1. The β and γ events were selected with the help of two pulse-shape discrimination methods: the optimal filter method to select α particles, and the front edge analysis to select Bi–Po events (fast sub-chains^{212}Bi–^{212}Po and^{214}Bi–^{214}Po from^{232}Th and^{238}U chains, respectively) from internal contamination of the crystals by U and Th. Besides, both the pulse-shape discrimination techniques are also sensitive to pile-ups of^{116}CdWO_4 and liquid scintillator signals. The experimental spectrum was fitted in the energy interval (660 − 3300) keV by the model constructed from the two neutrino double beta (2ν2β) spectrum of^{116}Cd, the distributions of the^{116}CdWO_4 crystal scintillators internal contamination by potassium, thorium and uranium (taking into account possible disequilibrium of the^{232}Th and^{238}U chains), and the contribution from external γ quanta (from radioactive contamination of the PMTs, quartz light-guides and copper of the passive shield). Response of the^{116}CdWO_4 detector to the 2β processes in^{116}Cd as well as to the radioactive contamination of the set-up were simulated with EGS4 package [24]. The initial kinematics of the particles emitted in the decay of the nuclei was given by an event generator DECAY0 [25]. The fit gives the following half-life of^{116}Cd relatively to the 2ν2β decay to the ground state of^{116}Sn:

T^{2ν2β}_{1/2} = [2.62 ± 0.02(stat.) ± 0.14(syst.)] × 10^{19} yr.

The main sources of the systematic error are the uncertainties of the radioactive contamination of the crystal scintillators and of the details of the set-up, and variation of the effect’s area depending on the interval of the fit. The signal to background ratio is 2.6:1 in the energy interval (1.1 − 2.8) MeV. The comparison of the^{116}Cd 2ν2β half-life obtained in the Aurora experiment with other experiments is given in Fig. 2. The result is in agreement with the previous experiments [10, 11, 12, 13, 14, 15], however the half-life of^{116}Cd is determined in the present study with the highest accuracy.

Figure 1. The energy spectrum of β and γ events accumulated over 12015 h together with the main components of the background model: 2ν2β decay of^{116}Cd (“2ν2β^{116}Cd”), the distributions of the internal contamination of the^{116}CdWO_4 crystals by potassium (“int.^{40}K”), thorium (“int. Th”) and uranium (“int. U”), and the contribution from external γ quanta (“ext. γ”).

Figure 2. Comparison of the^{116}Cd 2ν2β halflife obtained in the Aurora experiment with other experiments: ELEGANT V [10], Solotvina [13, 14, 15], NEMO-2 [11] and NEMO-3 [12]. A reevaluated NEMO-2 value [26] is labelled as (NEMO-2)*.

There are no other peculiarities in the experimental data which could be interpreted as 2β processes in^{116}Cd. To estimate limit on 0ν2β decay of^{116}Cd to the ground state of^{116}Sn we have used data of two runs with the lowest background in the region of interest: the current one and the accumulated over 8696 h in the set-up described in [22]. The sum energy spectrum is presented in Fig. 3. The background counting rate of the detector in the energy interval (2.7 − 2.9) MeV (which contains 80% of the 0ν2β distribution) is ≈ 0.1 counts/(yr×kg×keV). A fit of the spectrum in the energy interval (2560−3200) keV by the background model constructed from the distributions of the 0ν2β decay of^{116}Cd (effect searched for), the 2ν2β decay of^{116}Cd with the half-life 2.62 × 10^{19} yr, the internal contamination of the crystals by^{110m}Ag and^{228}Th, and the contribution from external γ quanta gives an area of the expected peak S = −3.7±10.2, which gives no evidence of the effect. In accordance with [27] 13.3 counts are excluded at 90% confidence level. Taking into account the 99% efficiency of the pulse-shape discrimination to select β (γ) events and 99% efficiency of the front edge analysis (98% in total), we got the following new limit on the 0ν2β decay of^{116}Cd to the ground state of^{116}Sn:

T^{0ν2β}_{1/2} ≥ 1.9 × 10^{23} yr.

The half-life limit corresponds to the effective neutrino mass limit ⟨m_ν ⟩ ≤ (1.2 − 1.8) eV, obtained by using the recent nuclear matrix elements reported in [28, 29, 30, 31], the phase space factor from [32] and the value of the axial vector coupling constant g_A = 1.27.

Figure 3. The energy spectrum of β and γ events accumulated over 20711 h with the 116CdWO_4 detectors in the region of interest together with the background model: the 2ν2β decay of^{116}Cd (“2ν2β”), the internal contamination of the^{116}CdWO_4 crystals by cosmogenic^{110m}Ag (“^{110m}Ag”) and^{228}Th (“int. Th”), and the contribution from external γ quanta (“ext. γ”).

Limits on 2β decay processes in^{116}Cd to the excited levels of^{116}Sn, and for the 0ν2β decay with emission of one (χ), two (2χ) and bulk (χ^{bulk}) majorons were derived from the fits of the data in the energy intervals with a high effect to background ratio. The results are presented in Table 1. Using the bound on the 0ν2β decay with one majoron emission and the same calculations of the nuclear matrix elements we have estimated a limit on the effective majoron neutrino coupling constant g_{νχ} ≤ (5.3 − 8.5) × 10^{−5}.

4. Conclusions The Aurora experiment is in progress to investigate 2β processes in^{116}Cd by using enriched 116CdWO_4 scintillation detectors. The 2ν2β half-life of^{116}Cd is measured with the highest up-to-date accuracy: T_{1/2} = (2.62 ± 0.14) × 10^{19} yr. The new improved 0ν2β half-life limit was set as T_{1/2} ≥ 1.9 × 10^{23} yr at 90% CL, which corresponds to the effective Majorana neutrino mass ⟨m_ν ⟩ ≤ (1.2 − 1.8) eV. New limits on the 2β decay to excited levels of^{116}Sn and the 0ν2β decay with emission of one, two and bulk majorons were set at the level of T_{1/2} ≥ (10^{20} − 10^{22}) yr. Using the limit T_{1/2} ≥ 1.1 × 10^{22} yr on the 0ν2β decay with one majoron emission we have obtained one of the strongest limits on the effective majoron neutrino coupling constant g_{νχ} ≤ (5.3 − 8.5) × 10^{−5}. It is worth noting that we have observed a segregation of thorium, radium and potassium in the crystal growing process, which provides a possibility to improve substantially the radiopurity of the^{116}CdWO_4 crystal scintillators by re-crystallization, which is in progress now.

References

[1] Mohapatra R N et al 2007 Rep. Prog. Phys. 70 1757 [2] Vergados J D, Ejiri H, Šimkovic F 2012 Rep. Prog. Phys. 75 106301 [3] Barea J, Kotila J, Iachello F 2012 Phys. Rev. Lett. 109 042501 [4] Rodejohann W 2012 J. Phys. G 39 124008

Table 1. The half-life limits and half-life value on the 2β decay processes in^{116}Cd. The most stringent limits obtained in the previous experiments are given for comparison. The limits are given at the 90% CL except the results [17], which are given at the 68% CL.

Decay mode Transition, T_{1/2} (yr) Previous level of^{116}Cd result (keV)

0ν g.s. ≥ 1.9 × 10^{23} ≥ 1.7 × 10^{23} [15] 0ν 2^+(1294) ≥ 6.2 × 10^{22} ≥ 2.9 × 10^{22} [15] 0ν 0^+(1757) ≥ 6.3 × 10^{22} ≥ 1.4 × 10^{22} [15] 0ν 0^+(2027) ≥ 4.5 × 10^{22} ≥ 6.0 × 10^{21} [15] 0ν 2^+(2112) ≥ 3.6 × 10^{22} ≥ 1.7 × 10^{20} [17] 0ν 2^+(2225) ≥ 4.1 × 10^{22} ≥ 1.0 × 10^{20} [17] 0νχ g.s. ≥ 1.1 × 10^{22} ≥ 8.0 × 10^{21} [15] 0ν2χ g.s. ≥ 9.0 × 10^{20} ≥ 8.0 × 10^{20} [15] 0νχ^{bulk} g.s. ≥ 2.1 × 10^{21} ≥ 1.7 × 10^{21} [15] 2ν g.s. = (2.62 ± 0.14) × 10^{19} see Fig. 2 2ν 2^+(1294) ≥ 9.0 × 10^{20} ≥ 2.3 × 10^{21} [18] 2ν 2^+(1757) ≥ 1.0 × 10^{21} ≥ 2.0 × 10^{21} [18] 2ν 2^+(2027) ≥ 1.1 × 10^{21} ≥ 2.0 × 10^{21} [18] 2ν 2^+(2112) ≥ 2.3 × 10^{21} ≥ 1.7 × 10^{20} [17] 2ν 2^+(2225) ≥ 2.5 × 10^{21} ≥ 1.0 × 10^{20} [17]

[5] Deppisch F F, Hirsch M, Päs H 2012 J. Phys. G 39 124007 [6] Bilenky S M, Giunti C 2015 Int. J. Mod. Phys. A 30 1530001 [7] Päs H and Rodejohann W 2015 New J. Phys. 17 115010 [8] Rahaman S et al 2011 Phys. Lett. B 703 412 [9] Berglund M, Wieser M E 2011 Pure Appl. Chem. 83 397 [10] Ejiri H et al 1995 J. Phys. Soc. Japan 64 339 [11] Arnold R et al 1996 Z. Phys. C 72 239 [12] Tretyak V I et al 2013 AIP Conf. Proc. 1572 110 [13] Danevich F A et al 1995 Phys. Lett. B 344 72 [14] Danevich F A et al 2000 Phys. Rev. C 62 045501 [15] Danevich F A et al 2003 Phys. Rev. C 68 035501 [16] Ebert J et al 2013 AHEP 2013 703572 [17] Barabash A S, Kopylov A V, Cherehovsky V I 1990 Phys. Lett. B 249 186 [18] Piepke A et al 1994 Nucl. Phys. A 577 493 [19] Barabash A S et al 2011 JINST 06 p08011 [20] Poda D V et al 2013 Radiat. Meas. 56 66 [21] Danevich F A et al 2013 AIP Conf. Proc. 1549 201 [22] Poda D V et al 2014 EPJ Web of Conferences 65 01005 [23] Polischuk O G et al 2015 AIP Conf. Proc. 1686 020017 [24] Nelson W R et al The EGS4 code system, SLAC-Report-265 (Stanford, 1985) [25] Ponkratenko O A, Tretyak V I, Zdesenko Yu G 2000 Phys. Atom. Nuclei 63 1282 [26] Barabash A S 2010 Phys. Rev. C 81 035501 [27] Feldman G J, Cousins R D 1998 Phys. Rev. D 57 3873 [28] Rodriguez T R, Martinez-Pinedo G 2010 Phys. Rev. Lett. 105 252503 [29] Šimkovic F et al 2013 Phys. Rev. C 87 045501 [30] Hyvärinen J, Suhonen J 2015 Phys. Rev. C 91 024613 [31] Barea J, Kotila J, Iachello F 2015 Phys. Rev. C 91 034304 [32] Kotila J, Iachello F 2012 Phys. Rev. C 85 034316