arXiv:1510.05817v1 [astro-ph.IM] 20 Oct 2015

Journal of the Korean Astronomical Society http://dx.doi.org/10.5303/JKAS.2014.00.0.1 00: 1 ∼ 99, 2014 May pISSN: 1225-4614 · eISSN: 2288-890X © 2014. The Korean Astronomical Society. All rights reserved. http://jkas.kas.org

INTERFEROMETRIC MONITORING OF GAMMA–RAY BRIGHT ACTIVE GALACTIC NUCLEI II: FREQUENCY PHASE TRANSFER^†

Juan-Carlos Algaba^1, Guang-Yao Zhao^1, Sang-Sung Lee^{1,2}, Do-Young Byun^1, Sin-Cheol Kang^{1,2}, Dae-Won Kim^3, Jae-Young Kim^3, Jeong-Sook Kim^4, Soon-Wook Kim^{1,2}, Motoki Kino^1, Atsushi Miyazaki^{1,5}, Jong-Ho Park^3 , Sascha Trippe^3, and Kiyoaki Wajima^1

1Korea Astronomy and Space Science Institute, 776, Daedeokdae-ro, Yuseong-gu, Daejeon, Republic of Korea 305-348;

algaba@kasi.re.kr

2Korea University of Science and Technology, 176 Gajeong-dong, Yuseong-gu, Daejeon, 305, 350, Korea 3Department of Physics and Astronomy, Seoul National University, 599 Gwanak-ro, Gwanak-gu, Seoul 151, 742, Korea 4National Astronomical Observatory of Japan, 2-21-1 Osawa, Mitaka, Tokyo 181-8588, Japan 5Faculty of Science and Engineering, Hosei University, 3-7-2 Kajino-cho, Koganei, Tokyo 184-8584, Japan

Received February 30, 2014; accepted February 31, 2014

Abstract: The Interferometric Monitoring of Gamma–ray Bright Active galactic nuclei (iMOGABA) program provides not only simultaneous multifrequency observations of bright gamma–ray detected active galactic nuclei (AGN), but also covers the highest Very Large Baseline Interferometry (VLBI) frequencies ever being systematically monitored, up to 129 GHz. However, observation and imaging of weak sources at the highest observed frequencies is very challenging. In the second paper in this series, we evaluate the viability of the frequency phase transfer technique to iMOGABA in order to obtain larger coherence time at the higher frequencies of this program (86 and 129 GHz) and image additional sources that were not detected using standard techniques. We find that this method is applicable to the iMOGABA program even under non–optimal weather conditions.

Key words: galaxies: active – methods: data analysis – techniques: high angular resolution – techniques: interferometric

1. INTRODUCTION

Active galactic nuclei (AGN) emit over a wide range of wavelengths from radio to gamma-rays. Most of the γ−ray sources detected by EGRET telescope were identified as blazars (Mattox et al 2001; Sowards-Emmerd et al. 2003, 2004). This was later confirmed with the Fermi LAT (see e.g., Abdo et al. 2009; Kovalev 2009; Lister et al 2009; Abdo et al. 2010; Ackermann et al. 2011). Variability, which seems to be common in these objects, was also seen to be correlated (Kovalev et al. 2009). In some cases a time delay was found, with the flares leading at higher frequencies (Stevens et al. 1994; Pushkarev et al. 2010). Furthermore, monitoring of a sample of EGRET blazars with VLBI at 43 GHz suggested the association with γ−ray events and the emergence of parsec–scale radio knots moving downstream the jet (Jorstad et al. 2001). These findings were corroborated by single–dish and VLBA observations at 22, 37 and 43 GHz (Savolainen et al. 2002; Lähteenmaki & Valtaoja 2003).

Based on these findings, it appears that gamma-ray emission is associated with emission arising from the upstream millimeter radio–emiting regions of the jet. The exact location of the gamma–ray flares is nonetheless yet unclear. On one hand, rapid timescales seem to

Corresponding author: J. C. Algaba †Part of a special issue on the Korean VLBI Network (KVN)

suggest an innermost origin, within the broad line region. On the other hand, connection with parsec scale events suggests larger scales. Additionally, the cause behind the gamma-ray flares is also not always clear: they might be produced due to a local compression and heating of the plasma, in–situ generation of relativistic particles or variability of flux and magnetic fields.

The shock–in–jet model proposed by Marscher & Gear (1985) aimed to explain these observations. In this model, a shock wave travels downstream a steady jet and relativistic particles crossing the shock front gain energy. The flaring flux is produced by accelerated particles behind the shock front. Modifications of this model including jet geometry or multiple Compton scattering were later performed and used to successfully model flaring observations (see e.g., Fromm et al. 2011, and references therein). Alternatively, some turbulent multi-zone models can also explain the multi-frequency variability in blazars (Marscher 2014).

The observed properties of synchrotron flares may depend on the peak frequency and its relation with the observed frequency (e.g., Valtaoja et al 1992). Given that turnover frequencies at the beginning of flares can be ν_m > 30 GHz (Fromm et al. 2013), observations at millimeter and sub-millimeter wavelengths are crucial in probing the most compact regions, where the radiation is optically thin, and investigate flares in their growth state. Multi-frequency multi-epoch observations of 1

2 J. C. Algaba et al

AGN have been shown to be very useful to study the physical properties of these objects. In this sense, monitoring programs can help us understand the emission properties and follow-up the behavior of the innermost regions of AGN, both for individual objects and in a statistical sense. Traditionally, however, such programs have been limited to single dish (hence, resolution– limited) (e.g., UMRAO database^1, Metsähovi Quasar Research^2) or to relatively low frequency observations ≲ 43 GHz (e.g., MOJAVE^3, TANAMI^4 or VLBA-BU- BLAZAR^5).

The interferometric MOnitoring of GAmma-ray Bright AGN (iMOGABA) does not suffer from these drawbacks, as it provides the highest radio frequencies ever being systematically monitored (22, 43, 86 and 129 GHz) and uses the unique simultaneous multi– frequency capabilities of the Korean VLBI Network (KVN). This program is novel with regards to previous VLBI observations at 86 and 129 GHz and has thus a clear advantage over other similar programs to investigate the validity of the various models to explain γ−ray flares in AGN. The iMOGABA specifications and science goals are discussed in Lee et al. (2013, 2015) and Wajima et al. (2015).

Among a series of early results in the iMOGABA program, in this paper we particularly evaluate the viability of the frequency phase transfer (FPT) technique. We prove its usefulness in order to detect and obtain images of faint sources at hight frequencies that could not be obtained otherwise with standard techniques. The organization of this paper is as follows. In Section 2 we briefly introduce the methodology used for the calibration technique; in Section 3 we summarize the observations and data reduction; in Section 4 we present the results of the FPT and in Section 5 we discuss them. We summarize and provide our conclusions in Section 6.

2. FREQUENCY PHASE TRANSFER

High frequency VLBI observations are challenging. First, the antenna, electronics and optics are much more demanding for high frequencies, which results in much higher receiver temperatures. Likewise, atmospheric effects, and particularly tropospheric effects, become much more important both in terms of opacity and coherence time. For a review of the system performance, in particular in K and Q bands, see Lee et al. (2014). Moreover, due to the optically thin spectra of most of the AGN at such frequencies, their fluxes become relatively weak and the number of effectively observable sources becomes very limited (Lee et al. 2008).

Standard VLBI data handling includes data reduction in Aips consisting of amplitude and phase calibration, splitting the various sources at each frequency

1https://dept.astro.lsa.umich.edu/datasets/umrao.php 2http://www.metsahovi.fi/quasar/ 3http://www.physics.purdue.edu/astro/MOJAVE/index.html 4http://pulsar.sternwarte.uni-erlangen.de/tanami/ 5http://www.bu.edu/blazars/VLBAproject.html

and independently imaging them in Difmap using hybrid mapping with phase–only self-calibration. In practice, this is not always possible for all iMOGABA target sources. Given a system equivalent flux density (SEFD) larger than a few thousand at frequencies ≳ 43GHz for KVN antennas, a longer integration time (few minutes) is needed for the faintest sources (few tens of mJy) for secure detection. However, the coherence times are normally limited to shorter scales by the sky conditions.

In order to overcome tropospheric limitations in VLBI observations, phase reference techniques have been typically used (see e.g., Alef 1989; Beasley & Conway 1995). These methods are however very challenging over frequencies above 43 GHz and only a single observation has been proved successful at 86 GHz for a pair of sources separated by only 14 arcseconds (Porcas & Rioja 2002). The frequency phase transfer (FPT) technique aims to circumvent this limitation. Under the assumption that the tropospheric path delay is independent of the frequency, we can correct for it at high frequencies by extrapolating from lower frequencies.

Early applications of this technique were performed on connected arrays such as the Nobeyama millimeter array (Asaki et al. 1998) or the VLA (Carilli & Holdaway 1999). Using fast frequency switching with the VLBA, mm-VLBI observations were performed by Middelberg et al. (2005) to increase the coherence time; furthermore, successful astrometric calibration using source frequency phase reference were performed by Dodson & Rioja (2009) and Rioja & Dodson (2011). The multi–channel receivers at the KVN allow for simultaneous observations at 22, 43, 86 and 129 GHz (Oh et al. 2011; Han et al. 2013) and are therefore ideal to apply this technique, as they avoid the need of frequency switching and interpolation. Performance of the Korean VLBI Network was first tested by Rioja et al. (2014a,b, 2015), Jung et al. (2014) or Zhao et al. (2015) on specifically designed observations.

2.1. Method

Frequency phase transfer (FPT) uses the observations of a source at a low frequency to calibrate the tropospheric errors at a higher frequency. This method is a simplification of the source-frequency phase reference described in detail in Rioja & Dodson (2011) and Rioja et al. (2014a), and is particularly useful when we do not require accurate astrometry of the sources. We briefly discuss the application of this technique to our case here. The residual phase errors for the reference (low) frequency can be described as: ϕ_{low} = ϕ^{str}_{low} +ϕ^{geo}_{low} +ϕ^{trop}_{low} +ϕ^{ion}_{low} +ϕ^{inst}_{low} +ϕ^{th}_{low} +2πn_{low}, (1) where the indices indicate contributions from structure, geometric, tropospheric, ionospheric, instrumental, and thermal effects. The last term originates from the 2π ambiguity for the phase, with n_{low} an integer. A point source has ϕ^{str}_{low} = 0, and the ϕ^{th}_{low} term has a negligible iMOGABA II: Frequency Phase Transfer 3

contribution compared with the rest. A similar expression can be written for the residual phase errors for the target (high) frequency ϕ_{high}.

Our low-frequency self-calibrated map contains a set of antenna-based corrections ϕ^{self cal}_{low} , which account for the structure. If we scale by the frequency ratio R = ν_{high}/ν_{low} and transfer for the tropospheric calibration of the high-frequency data, the residual target phases are ϕ^{F P T} = ϕ_{high} − R · ϕ^{self cal}_{low} = = ϕ^{str}_{high} + (ϕ^{geo}_{high} − R · ϕ^{geo}_{low}) + (ϕ^{tro}_{high} − R · ϕ^{tro}_{low} ) + +(ϕ^{ion}_{high} − R · ϕ^{ion}_{low}) + (ϕ^{ins}_{high} − R · ϕ^{ins}_{low} ) + +2π(n_{high} − R · n_{low}), (2) where we have already excluded the thermal term for simplicity.

The tropospheric residual errors scale linearly with frequency, so we can approximate this term to become negligible. The ionospheric errors are inversely proportional to the frequency, the geometric residual errors cancelling out except for a frequency–dependent source position shift θ, and depending on the baseline D. Thus, the residual target phases become ϕ^{F P T} = ϕ^{str}_{high} + 2πD · θ + ( 1 R − R ) ϕ^{ion}_{low} + +(ϕ^{ins}_{high} − R · ϕ^{ins}_{low} ) + +2π(n_{high} − R · n_{low}). (3) Thus, high frequency visibilities are free of random and tropospheric errors but contain un–modelled ionospheric and instrumental residual phase errors that are blended with the core shift or the positional phases. In general, this limits the coherence time to timescales of several tens of minutes, which is in any case much longer than the initial coherence time. The removal of long term drifts and other offsets requires self-calibration and hybrid mapping and in any case removes any positional information included in θ. Alternatively, including the observations of a second source, it is possible to recover the astrometric signature; this is the basis for source frequency phase reference (SFPR).

The ratio R is highly recommended to be an integer, to avoid unreasonable extrapolations when phase wraps occur in the data. For example, if the frequency ratio is a non integer (e.g., R=2.5), and the reference frequency wraps from 359^∘ to 0^∘, then the scaled frequency wraps from 897.5^∘ (=177.5^∘) to 0^∘, introducing an undesired phase wrap in the target frequency of 177.5^∘ (Middelberg et al. 2005).

As discussed in depth in Rioja & Dodson (2011), the errors induced due to the FPT technique are negligible: first, given the identical line of sight at the two frequencies, other than micro–arcsecond core–shifts, both geometric and tropospheric (static component) errors can be proven to be almost identical to zero. The errors of the dynamic component of the troposphere also cancels out for our synchronous multi–frequency observations. Thus, based on this error analysis, the errors associated with the FPT high frequency images are dominated by the usual thermal, ionospheric, and instrumental errors and no further error analysis is needed.

3. OBSERVATIONS AND DATA REDUCTION

In order to properly evaluate the conditions for FPT, we selected two different epochs from the iMOGABA monitoring: epoch 9 (hereafter iMOGABA9), observed on 2013/11/19, which is one of the epochs with the best overall weather on KVN stations, and epoch 15 (hereafter (iMOGABA15), observed on 2014/06/13, which accounts for one of the most overall poor weather. For both epochs, we observed up to 31 gamma-ray bright AGN^6 during a 22-hours session at 21.7, 43.4, 86.8 and 129.3 GHz simultaneously using the snapshot mode. The total 16 IFs (spectral windows) with a full bandwidth of 256 MHz were equally distributed among the four frequencies, with 64 MHz each. The typical scan length was about 5 minutes, and sources were observed over 2–10 scans (about 5 scans on average), depending on their flux and declination. For example, in iMO- GABA15, 0827+243 and 3C84 were observed for 2 and 10 scans respectively.

Data reduction was separated in two steps. For the first step, typical VLBI data reduction was employed: after loading the data in the NRAO Aips package, data was flagged according to the observing logs. In the case of iMOGABA15, unusual pointing offsets as large as 50 arc seconds in azimuth direction and 400 arc seconds in elevation on the KVN Tamna antenna during the beginning (UT 05:42–16:02) of the epoch were detected, causing large amplitude losses for the baselines with Tamna. Furthermore, we found an additional amplitude loss at 86 and 129 GHz of about 30% related with Tamna that was not associated with the antenna offset. We checked for other possible causes and ruled out its origin arising from source structure, source coordinates or different polarization feeds in this antenna. We suggest the cause may be related to inaccurate system temperature measurements.

Correction for amplitudes in cross-correlation spectra due to errors in sampler thresholds and amplitude calibration were performed with Aips tasks ACCOR and APCAL respectively. Bandpass correction was applied using the sources 3C454.3 and 3C84. Manual phase calibration was done to estimate the residual antennabased residuals phases using a 10 seconds time interval on a scan of 3C454.3 as calibrator. A final fringe fitting was performed with a solution interval of 30 seconds, signal–to–noise ratio cutoff of 5, and combining all the IFs for a given frequency. The reference antennas used were Ulsan for iMOGABA9 and Tamna for iMO- GABA15, which performed better than the other two antennas despite the amplitude problems due to comparatively better weather conditions. The data were then split and imaged with Difmap.

The second step included the implementation of the FPT technique. We removed the source structure con-

6For a complete list of sources, see sslee.kasi.re.kr

4 J. C. Algaba et al

Table 1 iMOGABA9 Expected Detection Limits at 86 GHz

Source SEFD (Jy) S^{86} (mJy) SNR^{86}_{30s} SNR^{86}_{300s}

0235+164 3300 400 6 20 0827+243 3900 220 3 10 1343+451 3100 210 4 11

tribution by using the low (22 or 43 GHz) frequency hybrid maps from the previous step as input models for the fringe-fitting. We then scaled the phases using the parameter ‘XFER’ of the task SNCOR and applied the solutions to the high frequency (86 or 129 GHz) visibilities of the same source. Given that the various frequencies are simultaneously observed in the KVN system, no interpolation was needed. The results of this calibration are free of tropospheric errors, with increased coherence time. We finally re–fringe–fitted the FPT–calibrated data with a larger solution interval of 300 seconds and signal–to–noise ratio threshold equal to 3.

For iMOGABA9, when solutions were found, the high frequency data were then split and imaged with Difmap. This was not possible for iMOGABA15 because of the amplitude offset problems which do not affect significantly the FPT technique other than in terms of SNR, but may have a dramatic impact on imaging. This is specially true for the case of KVN for which poor UV coverage and no closure amplitudes can be obtained, due to the low number of baselines. See Rioja et al. (2015) for alternative ways to estimate the global amplitude gain corrections with KVN observations.

4. RESULTS

4.1. iMOGABA9

4.1.1. Frequency Phase Transfer to 86 GHz

The system equivalent flux density (SEFD) for iMO- GABA9 at 86 GHz was around 3 − 4 × 10^3 Jy. The baseline–based sensitivity limit was then σ^{theo}_{min} ∼60 mJy and σ^{theo}_{min} ∼20 mJy for 30 and 300 seconds integration time, respectively, considering a 2-bit sampling, two antennas, and 64 MHz bandwidth. Three sources could not be imaged in a robust way at 86 GHz with the standard methods presented in Wajima et al. (2015): 0235+164, 0827+243 and 1343+451. In Table 1 we show these sources, their expected peak flux based on an extrapolation from lower frequencies and/or posteriori knowledge, and the detection SNR for an integration time of 30 and 300 seconds.

Based on these data, it seems clear that the typical reduction analysis used in Lee et al. (2015) is not capable to detect these sources with a high SNR^{86} ≳ 3 level, typically used as a cutoff in the fringe fitting. However, if we use instead the FPT technique, we can increase the coherence time to about 5 minutes and integrate the signal within such solution interval, leading to clear detection and imaging of these sources.

We calibrated the phases at 22 GHz, and transferred the scaled solutions of each source to 86 GHz (R = ν_{high}/ν_{low} = 4). We then applied these solutions to the 86 GHz visibilities. Plots of the visibility phases can be seen in Figure 1. Although the limited number of scans prevents us from properly following the phase trends, it is clear that there is a reasonable alignment of the phases around a certain value. We remind here that such phase solutions were either very poor or nonexistent for typical self–calibration analysis, while the FPT analysis allows us to find solutions with high SNR for longer integration times (up to the duration of the scans, ∼5 minutes) and therefore permits us to find fringe solutions and perform posterior mapping.

In order to check for consistency and compare our results, we also transferred scaled solutions from phases calibrated at 43 GHz (R=2). We plot such calibrated visibility phases in Figure 2, which can be directly compared with Figure 1. Although the scaling factor is 2 times smaller for this transfer, naively suggesting a factor of 2 lower scatter in the scaled solutions, it is clear that the fading of these sources at 43 GHz compared to 22 GHz due to its spectral index is degrading the SNR of the phase solutions and hence increasing the residual errors. Indeed, we found that fringe SNR^22 ∼45 and SNR^43 ∼28 for 0235+164, 0528+134 and 0735+178. Combined with the overall performance of the KVN system (higher SEFD, larger pointing errors) at higher frequencies, this explains the similarities between the phase solutions transferred from 22 and 43 GHz.

After the FPT, we re-fringed the data to align the phases with a solution interval that effectively covers the whole scan (∼5 minutes). Due to the still significant scatter in some of the calibrated visibilities, some solutions were not found. This was the case, for example, for Tamna baselines on the first scan for 0235+164; or all baselines on the second scan for 1343+451. This effect was particularly severe here, as we obtained only a single solution for each scan due to the long solution interval. This means that a failed solution automatically discarded all the data for a scan. Additionally, this implied that, during imaging, self–calibration also failed for the scans without solutions for a given baseline. In some cases, visibilities of only a single scan were left.

All three sources could be imaged after the analysis using FPT was performed. This is in agreement with expectations from Table 1. We find almost identical results for visibilities analyzed with FPT from either 22 or 43 GHz after self–calibration was performed. Maps are shown in Figure 3.

4.1.2. Frequency Phase Transfer to 129 GHz

The system equivalent flux density (SEFD) for iMO- GABA9 at 129 GHz was around 5 − 8 × 10^3 Jy. The baseline–based sensitivity limit was then σ^{theo}_{min} ∼300– 500 mJy and σ^{theo}_{min} ∼30–40 mJy for 30 and 300 seconds integration time, respectively, considering a 2-bit sampling, two antennas and 64 MHz bandwidth. Up to twelve sources could not be imaged in iMOGABA9 iMOGABA II: Frequency Phase Transfer 5

Table 2 iMOGABA9 Expected Detection Limits at 129 GHz

Source SEFD (Jy) S^{129} (mJy) SNR^{129}_{30s} SNR^{129}_{300s}

0235+164 5600 260 3 8 0528+134 5300 300 3 10 0735+178 5900 380 4 11 0827+243 8000 100 1 2 0836+710 6100 270 2 8 1127–145 8000 750 5 16 1156+295 5100 500 5 17 1222+216 5300 340 3 11 1308+326 5900 360 3 11 1343+451 5300 90 1 3 1611+343 5900 540 5 16 3C446 5100 250 3 8

with standard methods at 129 GHz. In Table 2 we show these sources, their expected peak flux based on an extrapolated flux form the lower frequencies and the detection SNR for an integration time of 30 and 300 seconds.

Based on the expected values, it seems clear that, in general, no images, or marginal detections would be obtained using standard calibration methods with typical integration times of ∼30 seconds for these sources. Moreover, it appears that in some cases SNR^{129}_{300s} < 10 for several sources. In particular, SNR^{129}_{300s} is < 5 for 0827+243 and 1343+451. This has very clear implications: the maximum achievable solution interval, ultimately given by the scan duration, which is about ∼5 minutes in these observations, is not enough for a detection. This implies that there is a priori no possibility to image these sources, even using the FPT technique. Improved weather and system conditions or a brightening of the targets would be needed in order to image these two sources up to 129 GHz.

Following identical procedure as in Section 4.1.1, we transferred the solutions from 22 and 43 GHz to 129 GHz (frequency ratios R=6 and 3, respectively). We did not attempt FPT from 86 GHz given that the ratio would not be an integer number. Plots of the FPT calibrated visibilities are shown in Figure 4 for a transfer from 22 GHz and Figure 5 for a transfer from 43 GHz, respectively.

As seen for the transfer to 86 GHz, comparison of Figures 4 and 5 indicate that both transfers to 129 GHz also lead to similar results. Further inspection shows that for these sources with a larger estimated SNR^{129}, the scatter in the transferred phases is smaller. This is the case for example for 0528+134, 0735+178, and 1222+216. On the other hand, sources with smaller SNR^{129}, such as 1343+451, have a comparatively larger scatter.

After re-fringing the phase, we found no solutions for 0235+164, 0827+243, and 1343+451. Solutions were found at all baselines for at least one scan for the other sources. These results are in agreement with the a priori expectation based on Table 2. Maps of sources that could be imaged are shown in Figure 6. Obtained peak

Table 3 iMOGABA15 Expected Detection Limits at 86 GHz

Source SEFD (Jy) S^{86} (mJy) SNR^{86}_{30s} SNR^{86}_{300s}

0235+164 4700 630 7 23 0420–014 5600 880 9 27 0727–115 7500 1000 8 24 0735+178 5600 500 5 16 0827+243 9400 440 3 8 0836+710 4700 580 7 21 1510–089 7500 1300 10 30 1611+343 22500 1200 3 9 4C39.25 22500 1300 3 10 CTA102 22500 1000 2 8 NRAO530 28000 1400 3 9

fluxes are in good agreement with the expected values (c.f. Table 2), except for 1127–145, which seems to have a lower flux than expected. In terms of detection limits, this implies that SNR^{129}_{300s} for this source has been overestimated, and the real value should be also smaller, but still larger than our cutoff value.

4.2. iMOGABA15

4.2.1. Frequency Phase Transfer to 86 GHz

Given the poor weather conditions during this epoch, representative system equivalent flux densities (SEFDs) for iMOGABA15 at 86 GHz were in the range 5 − 28 × 10^3 Jy^7. This leads to a baseline–based sensitivity limit σ^{theo}_{min} ∼100–500 mJy and σ^{theo}_{min} ∼30–150 mJy for 30 and 300 seconds integration times, respectively, considering a 2-bit sampling, two antennas and 64 MHz bandwidth. Up to eleven sources could not be imaged in iMOGABA15 with standard methods at 86 GHz. In Table 3 we show these sources, their expected peak flux based on an extrapolation from lower frequencies and the detection SNR for an integration times of 30 and 300 seconds.

Based on the values in Table 3, we expect to detect some of these sources with standard methods. Note however that the amplitude offset problem caused by the Tamna antenna decreased the flux in related baselines, thus making it more difficult in practice to get fringes with the expected SNR and achieve a proper self-calibration. With an amplitude loss of about 30%, all sources with the exception of 0420–014 and 1510–089 have SNR≲ 5, which falls below the detection limits.

We use the FPT technique for this data, given that a five minute integration time allows us to detect all the sources in our sample. As for iMOGABA9, we have performed the transfer from both 22 and 43 GHz for consistency checking and comparison. Plots of the FPT calibrated phase visibilities from 22 and 43 GHz are shown in Figures 7 and 8 respectively.

A relatively low scatter in the phases is obtained for a significant number of sources (e.g., 0235+164, 0420–

7We considered here SEFDs from Ulsan and Yonsei antennas, due to the amplitude issue on Tamna, which may lead to incorrect values for its SEFD

6 J. C. Algaba et al

014, 1611+343, CTA102 or NRAO530). Much larger scatter is found for some sources, including 0827+243, 0836+710 and 4C39.25, despite the fact that some of them show an a priori larger SNR^{86}. This effect may be due to the amplitude loss problem. Note indeed that 0836+710 and 4C39.25 were directly affected by the Tamna antenna offset issue. Furthermore, it is clear that the Ulsan–Yonsei baseline, which is free from this problem, shows on average better solutions^8.

Comparison between Figures 7 and 8 shows an agreement between the results from the FPT from 22 and 43 GHz. In some sources (e.g., CTA102), the phase dispersion seems to be larger based on the transfer from 22 GHz. This is expected as this source was optically thick during our observations, with a peak flux of S^{22} ∼ 100 mJy and S^{43} ∼ 150 mJy. This leads to a higher SNR at 43 than 22 GHz which, combined with the smaller frequency ratio scaling R, naturally leads to better phase stability when performing the transfer.

We inspected the data after the successful frequency transfer and proceeded to re–fringe fitting with a solution interval of 5 minutes, and applied the solutions to the data. However, due to the various amplitude offset problems, we considered the data is not robust enough to consider a reliable imaging with accurate flux and structure. We thus do not show the related frequency phase transferred maps here.

4.2.2. Frequency Phase Transfer to 129 GHz

No sources were imaged for iMOGABA15 at 129 GHz using standard VLBI reduction methods. SEFDs for this frequency are in the range 10 − 80 × 10^3 Jy, which implies baseline based sensitivity limits σ^{theo}_{min} ∼200– 1500 mJy and σ^{theo}_{min} ∼60–500 mJy for 30 and 300 seconds integration times, respectively. In Table 4 we summarize the SEFDs, expected flux at 129 GHz and detection limits for integration times of 30 and 300 seconds. Note that not all the sources in iMOGABA15 are included because a proper estimate for the extrapolated flux at 129 GHz could not be obtained due to the amplitude offset problem at lower frequencies.

Inspection of Table 4 allows us to quantitatively understand the effects of the bad weather on the iMO- GABA targets at 129 GHz. Due to the large SEFDs, it is challenging to get significant detections for the majority of our sources. Even with integration times of about 5 minutes there are 13 sources that do not reach SNR^{129}_{300s} > 5 and only 8 of the brightest sources reach larger values.

We performed the FPT on all the sources discussed here from 22 and 43 GHz to 129 GHz. Results for the calibrated phases are shown in Figures 9 and 10. Simple inspection reveals large phase scatter in most of the sources, with the exception of the bright source 3C454.3, possibly 3C84 and CTA102. As before, the scatter is lower for the Ulsan–Yonsei baseline. Comparison of the results transferred from 22 and 43 GHz reveal no significant differences.

8This can also be in combination with the fact that Ulsan–Yonsei is the shortest baseline.

Table 4 iMOGABA15 Expected Detection Limits at 129 GHz

Source SEFD (Jy) S^{129} (mJy) SNR^{129}_{30s} SNR^{129}_{300s}

0235+164 16000 490 2 5 0420–014 18700 440 1 4 0716+714 21300 920 2 7 0727–115 26700 440 1 3 0735+178 16000 410 1 4 0827+243 21300 320 1 3 0836+710 9300 310 2 6 1510–089 26700 860 2 6 1611+343 42700 650 1 3 1749+096 48000 2390 3 9 1921-293 80100 2020 1 4 3C345 45400 1200 1 5 3C454.3 40000 3500 5 15 3C84 50700 750 1 3 4C28.07 50700 630 1 2 4C38.41 50700 3030 3 10 4C39.25 42700 450 1 2 BL Lac 37400 1760 3 8 CTA102 42700 630 1 3 NRAO530 61400 880 1 2 OJ287 16000 2800 10 30

In practice, the large phase scatter results in the refringe fitting failing on virtually all sources. Reliable solutions for all baselines can be found only for 3C454.3 and possibly BL Lac. Based on Table 4, we consider that these detections may also be limited by the Tamna flux offset, leaving an actual SNR^{129}_{300s} lower than the estimated one. We do not perform imaging as the same limitations discussed for 86 GHz also appy here.

5. DISCUSSION

Many factors can affect the quality of the frequency phase transfer, including weather conditions (hence opacity, system temperature or system equivalent flux density), baseline length, source intensity and structure, and experimental design used (accuracy of the input model, frequency pair used). We will now discuss these effects in more detail.

The selection of the reference antenna is important to a level similar to other VLBI analysis. The ideal reference antenna is the one with systematically lower system temperatures and instrumental errors, as the latter will still be present even after manual phase calibration corrections, and will be transferred from the lower to the higher frequencies. Taking these two factors into consideration, together with an adequate integration solution interval, we can obtain the percentage of successful phase solutions, which we initially intend to maximize. We note however that, although the number of successful solutions steadily increases from 78% to 85% when adopting solution intervals from 0.1 to 5 minutes, the scatter and uncertainties of the solutions increase for integration times 0.5 minutes. This makes the 0.5 minutes as the the optimal solution interval (see Wajima et al. 2015, for a more detailed description).

iMOGABA II: Frequency Phase Transfer 7

Weather conditions are also very important. First, poor weather increases the effective SEFD, which in turn limits the number of sufficiently high SNR reliable phase (delay/rate) solutions. For example, the good weather conditions in iMOGABA9 and a fringe fitting with solution interval of 0.5 minutes result in about 80% good solutions, considering all frequencies. Contrary, for iMOGABA15, with poor weather, this number drops down to 50%. Second, the stability and clustering of these solutions at lower frequencies is crucial when extrapolating to higher frequencies. Finally, the maximum integration time that we will be able to achieve will be ultimately limited by atmospheric conditions.

Existing observations indicate that the limiting factors in the integration time are the ionospheric and instrumental residual errors. In the current iMOGABA schedule however, it is not possible to adequately discuss the latter in quantitative terms. Given the “snapshot mode” with an on–source scan time of ≲5 minutes, and typically limited to sim3 scans per source over 24 hours (scan separation of about few hours), we cannot obtain coherence information for these observations. Note however that for some particular sources (e.g., 3C454.3, CTA102, BL Lac) a larger number of scans is performed, and a clear trend over various hours is seen in the phase solutions (see e.g., Figures 7, 8, 9 and 10), indicating a large coherence time after the FPT. This is in agreement with existing measurements of the FPT coherence time with KVN antennas at 129 GHz of about 20 minutes (Rioja et al. 2014b, 2015).

One of the advantages of KVN is the multi–frequency simultaneous observations. Middelberg et al. (2005) and Rioja & Dodson (2011) considered VLBA fast frequency switching observations with 86 GHz which, unlike the simultaneous KVN observations, introduced interpolation errors arising from the frequency switching cycle, that degrade the performance. Rioja et al. (2014a) presents a comparative study between fast frequency switching VLBA and simultaneous KVN observations at 22/44 GHz. A quantitative discussion of the coherence time after FPT on multi–frequency KVN observations can be found in Rioja et al. (2015).

We calculated sensitivity limits for various combinations of frequencies and integration times and obtained the expected SNR for each source based on their expected flux. Our results for iMOGABA9 seem to indicate that a SNR> 5 is a minimum requirement for source detection after FPT, whereas larger values are generally preferred for as many scans as possible for later imaging. As we noted (e.g., for 0235+164 or 1343+451at 86 GHz), it is possible that some baseline– based phase solutions may have large scatter after the FPT, resulting in failed solutions after the re-fringe fitting, thus failing to obtain a proper self–calibration. Although no images were produced for iMOGABA15, results in this epoch seem consistent.

It is important to discuss the effects of the amplitude error calibration in the maps as well as in the measured fluxes. In principle, we know that the image noise level is a lower limit, as residual phase and amplitude errors affect the image quality and dynamic range. We first note that amplitude errors arising from FPT come only in the form of error propagation of the residual phase after amplitude vector averaging. An expression for the thermal noise phase error from FPT can be found in Rioja & Dodson (2011) and takes into account the phase error of the high frequency plus a weighted error from the transferred lower frequency by a factor of R^2/2. However, since the KVN system consists of only three antennas, it is not possible to perform amplitude calibration. One of the ways to estimate the latter is to compare the gain performance of KVN with other arrays. Observations with KaVA, where KVN antennas are a sub–array element, can be useful in this sense and show that uncertainties in the gain calibration are less than 10% (Niinuma et al. 2014). An extensive study on amplitude calibration errors for iMOGABA at all four frequencies will be given elsewhere (Wajima et al. 2015).

We also tested for stability of the solutions based on the source model accuracy. To do this, we performed the FPT again, but transferring the results from a typical fringe fitting at the lower frequency without the addition of a model image. The resulting phase solutions are very similar, if not identical. This is because, with our current setup, most of the sources are point– like or highly core–dominated. For example, 3C446, which is the most extreme case of resolved structure in our work, has a peak flux of 0.28 and an integrated flux of 0.31 Jy/beam, and more than 90% of the flux arises as a point–source.

The comparison of the phase transferred solutions using two different reference (low) frequencies studied here can help us to estimate how to choose the ideal reference frequency for the FPT. Two elements play a key role during the FPT: the weather conditions and the spectral index of the source. For sources with a flatter spectral index, using a higher frequency as the reference is preferred. This minimizes the extrapolation effects by a small frequency ratio R factor, while we do not lose a significant amount of SNR due to the decrease of the flux at higher frequencies. On the other hand, when dealing with steep spectra sources, then a lower reference frequency is be suggested, as SNR detection can be de deciding factor rather than weather conditions. This is particularly true for the weakest sources, which we aim to detect with FPT.

The analysis and discussions included in the series of iMOGABA papers, including in particular efforts towards techniques to improve the observational products, such as the FPT described here, are an important cornerstone to improve the overall performance in the next iMOGABA program observations. We can consider including also the SFPR or related strategies as a way to increase the sensitivity of KVN for detecting and hence monitoring weak sources or under poor weather conditions. One of the possibilities is to observe a sample of pre–selected sources with the SFPR mode in another session, followed by the normal iMO-

8 J. C. Algaba et al

GABA session. Hence we may be able to substantially increase the coherence time and, if available, to conduct relative astrometric observations on other interesting, but bright, sources.

6. CONCLUSIONS

We have applied the frequency phase transfer (FPT) technique to high frequency iMOGABA data in order to detect weak sources that cannot be detected and imaged with standard VLBI reduction methods. To evaluate the capabilities of this method we have tested it on two data sets, one epoch (iMOGABA9) with very good weather and high quality, and another epoch (iMO- GABA15) with bad weather and several issues, including antenna offsets and amplitude problems.

Our results indicate that we are able to perform the FPT and obtain detections and imaging for weak sources in agreement with theoretical expectations for sensitivity limits based on integration times of 5 minutes. We have succeeded even for the iMOGABA epoch with the worst conditions to date, which demonstrates the suitability of KVN antennas for this technique.

Although a quantitative analysis of the resulting coherence time cannot be performed adequately due to the “snapshot” characteristics of the iMOGABA observations, we suggest that it can reach values larger than 5 minutes in our data sets. One of the reasons for this is the multi–frequency capabilities of KVN, allowing to transfer the phase solutions to higher frequencies without any time interpolation, and the resulting large errors.

We have checked the consistency of our results by performing a series of tests, including frequency phase transfer from two frequencies, 22 and 43 GHz. We obtain similar results, consistent with expectations based on source flux and frequency ratios. Comparison of these results indicate how to estimate the ideal reference frequency to be used for the FPT, depending on sources’ spectral index and weather conditions. We have also checked for stability of the solutions under different reference antennas and source models. We have discussed the impact of weather, system conditions such as system temperature and system equivalent flux densities, and baseline lengths. In all cases, our results are in well agreement with expectations.

ACKNOWLEDGMENTS

We are grateful to all staff members in KVN who helped to operate the array and to correlate the data. We are very grateful for fruitful discussions with R. Dodson and M. Rioja. The KVN is a facility operated by the Korea Astronomy and Space Science Institute. The KVN operations are supported by KREONET (Korea Research Environment Open NETwork) which is managed and operated by KISTI (Korea Institute of Science and Technology Information).

REFERENCES

Abdo, A. A., et al, 2009, Fermi/Large Area Telescope Bright Gamma-Ray Source List, ApJS, 183, 46 Abdo, A. A., et al, 2010, Fermi Large Area Telescope and Multi-Wavelength Observations of the Flaring Activity of PKS 1510-089 Between 2008 September and 2009 June, ApJ, 721, 1425 Ackermann, M., et al, 2011, The Radio/gamma-ray Connection in Active Galactic Nuclei in the Era of the Fermi Large Area Telescope, ApJ, 741, 30 Alef, W., 1989. Introduction to phase-reference mapping.

NATO Advanced Study Institute on the Techniques and Applications of Very Long Baseline Interferometry, 261– 274 Asaki, Y., et al. 1998. Phase Compensation experiments with the paired antennas method 2. Millimeter-wave fringe correction using centimeter-wave reference. Radio Science 33, 1297-1318 Beasley, A. J., Conway, J. E., 1995. VLBI Phase– referencing. Very Long Baseline Interferometry and the VLBA NRAO Workshop No. 22, ASPC, 82, 327, edited by J.A. Zensus, P.J. Diamond, and P.J. Napier.

Carilli, C. L., Holdaway, M. A. 1999. Tropospheric phase calibration in millimeter interferometry. Radio Science 34, 817-840 Dodson, R., Rioja, M., 2009, VLBA Scientific Memorandum 31: Astrometric Calibration Of mm-VLBI Using Source Frequency Phase Referenced Observations Fromm, C. M., Perucho, M., Ros, E., Savolainen, T., Lobanov, A. P., Zensus, J. A., Aller, M. F., Aller, H. D., Gurwell, M. A., Lähteenmäki, A., 2011, Catching the radio flare in CTA 102. I. Light curve analysis, A&A, 531, 95 Fromm, C. M., Ros, E., Perucho, M., Savolainen, T., Mimica, P., Kadler, M., Lobanov, A. P., Zensus, J. A., 2013, Catching the radio flare in CTA 102. III. Core-shift and spectral analysis, A&A, 557, 105 Han, S.-T., Lee, J.-W., Kang, J., et al. 2013, Korean VLBI Network Receiver Optics for Simultaneous Multifrequency Observation: Evaluation, PASP, 125, 539 Jorstad, S. G., Marscher, A. P., Mattox, J. R., Aller, M. F., Aller, H. D., Wehrle, A. E., & Bloom, S. D. 2001,Multiepoch Very Long Baseline Array Observations of EGRET-detected Quasars and BL Lacertae Objects: Connection between Superluminal Ejections and Gamma-Ray Flares in Blazars, ApJ, 556, 738 Jung, T. H, Sohn, B. W., Byun, D. Y., 2014, Mm-VLBI Phase Correction Capability with the Korean VLBI Network, Proceedings of the 12th European VLBI Network Symposium and Users Meeting (EVN 2014). 7-10 October 2014. Cagliari, Italy.

Kovalev, Y. Y., Aller, H. D., Aller, M. F., Homan, D. C., Kadler, M., Kellermann, K. I., Kovalev, Yu. A., Lister, M. L., McCormick, M. J., Pushkarev, A. B., Ros, E., Zensus, J. A., 2009, The Relation Between AGN Gamma- Ray Emission and Parsec-Scale Radio Jets, ApJ 696, 17 Kovalev, Y. Y., 2009, Identification of the Early Fermi/LAT Gamma-Ray Bright Objects with Extragalactic VLBI Sources, ApJ 707, 56 Lähteenmäki, A., & Valtaoja, E. 2003, Testing of Inverse Compton Models for Active Galactic Nuclei with Gamma–Ray and Radio Observations, ApJ, 590, 95 Lee, S. S., Lobanov, A. P., Krichbaum, T. P., Witzel, A., Zensus, A., Bremer, M., Greve, A., Grewing, M., 2008, A Global 86 GHz VLBI Survey of Compact Radio Sources, iMOGABA II: Frequency Phase Transfer 9

AJ, 136, 159 Lee, S. S, Han, M. H, Kang, S. C., Seen, J. M., Byun, D. Y., Baek, J. H., Kim, S. W., Kim, J. S., 2013, Monitoring of multi-frequency polarization of gamma-ray bright AGN, EPJWC, 6107007 Lee, S. S., Petrov, L., Byun, D.Y., et al., 2014, Early Science with the Korean VLBI Network: Evaluation of System Performance, AJ, 147, 77 Lee, S. S., et al, 2015, in preparation Lister, M. L., Homan, D. C., Kadler, M., Kellermann, K.

I., Kovalev, Y. Y., Ros, E., Savolainen, T., Zensus, J. A., 2009, A Connection Between Apparent VLBA Jet Speeds and Initial Active Galactic Nucleus Detections Made by the Fermi Gamma-Ray Observatory, ApJ, 696, 22 Marscher, A. P., 2014, Turbulent Extreme Multi-Zone Model for Blazar Variability, ApJ 780, 87 Marscher, A. P., Gear, W. K., 1985, Models for highfrequency radio outbursts in extragalactic sources, with application to the early 1983 millimeter-to-infrared flare of 3C 273, ApJ, 298, 114 Mattox, J. R., Hartman, R. C., & Reimer, O. 2001, A Quantitative Evaluation of Potential Radio Identifications for 3EG EGRET Sources, ApJS, 135, 155 Middelberg, E., Roy, A. L., Walker, R. C., Falcke, H., 2005, VLBI Observations of Weak Sources Using Fast Frequency Switching, A&A, 433, 897 Niinuma, K., et al., 2014, VLBI observations of bright AGN jets with the KVN and VERA Array (KaVA): Evaluation of imaging capability, PASJ 66, 103 Oh, S.-J., Roh, D.-G., Wajima, K., et al. 2011, Design and Development of a High-Speed Data-Acquisition System for the Korean VLBI Network, PASJ, 63, 1229 Porcas, R., Rioja, M., 2002, VLBI phase-reference investigations at 86 GHz, in Proc 6th EVN Symp, ed. E. Ros, R. W. Porcas, A. P. Lobanov & J. A. Zensus, 65 Pushkarev, A. B., Kovalev, Y. Y., Lister, M. L., 2010 Radio/Gamma-Ray Time Delay In The Parsec-Scale Cores Of Active Galactic Nuclei, ApJ 722 L7 Rani, B., et al., 2013, Radio to Gamma-ray Variability Study of Blazar S5 0716+714 A&A., 552A, 11 Rioja, M, Dodson, R., 2011, High Precision Astrometric Millimeter Very Long Baseline Interferometry Using a New Method for Atmospheric Calibration, AJ, 141, 114 Rioja, M., Dodson, R., Jung, T. H., et al., 2014a, Verification of the Astrometric Performance of the Korean VLBI Network, Using Comparative SFPR Studies with The VLBA At 14/7 mm, AJ, 148, 84 Rioja, M., Dodson, R., Jung, T. H., Sohn, B. W., 2014b, Astrometry and New Methods Made Possible by the New Generation of Instruments. Proceedings of the 12th European VLBI Network Symposium and Users Meeting (EVN 2014) 7–10th October 2014, Cagliari, Italy.

Rioja, M., Dodson, R., Jung, T. H., Sohn, B. W., 2015, The Power of Simultaneous Multi–Frequency Observations for mm-VLBI: Astrometry up to 130 GHz with the KVN, Accepted for publication in AJ.

Savolainen, T., Wiik, K., Valtaoja, E., Jorstad, S. G., Marscher A. P., 2002, Connections between millimetre continuum variations and VLBI structure in 27 AGN, A&A 394, 851 Sowards-Emmerd, D., Romani, R. W., & Michelson, P. F.

2003, The Gamma–Ray Blazar Content of the Northern Sky, ApJ, 590, 109 Sowards-Emmerd, D., Romani, R. W., Michelson, P. F., & Ulvestad, J. S. 2004, Blazar Counterparts for 3EG

Sources at −40^∘ <Decl.< 0^∘: Pushing South through the Bulge, ApJ, 609, 564 Stevens, J. A., Litchfield, S. J., Robson, E. I., Hughes, D. H., Gear, W. K., Terasranta, H., Valtaoja, E., Tornikoski, M., 1994, Multi-frequency Observations of Balzars V. Long Term Millimiter, Sub-millimiter and Infra-red Monitoring, ApJ, 437, 91 Valtaoja, E., Teräsranta, H., Urpo, S., et al. 1992, Five Years Monitoring of Extragalactic Radio Sources - Part Three - Generalized Shock Models and the Dependence of Variability on Frequency, A&A, 254, 71 Wajima, K., Lee, S. S., Algaba, J. C., Byun, D. Y., Kang, S. C., Kim, D. W., Kim, J. Y., Kim, J. S., Kim, S. W., Kino, M, Miyazaki, A., Park, J. H., Trippe, S., Zhao, G. Y., 2015, Interferometric Monitoring Of Gamma-Ray Bright Active Galactic Nuclei I: Performance Evaluation Of Imaging Quality, JKAS, to be submitted.

Zhao, G. Y., Jung, T., Dodson, R., Rioja, M., Sohn, B. W., 2015, KVN Source-Frequency Phase–Referencing Observation of 3C 66A and 3C 66B, Proceedings of the 12th Asia-Pacific IAU Regional Meeting. 19-22 August 2014. Daejeon, Republic of Korea.

10 J. C. Algaba et al

(a) 0235+164 (b) 0827+243 (c) 1343+451 Figure 1. FPT visibility phases for iMOGABA9 observations at 86 GHz. Each data set was calibrated using the scaled solutions from the analysis of the same source at 22 GHz. Plots show temporal average of 30 seconds.

(a) 0235+164 (b) 0827+243 (c) 1343+451 Figure 2. Same as Figure 1, but using the scaled solutions from the analysis of the same source at 43 GHz.

Figure 3. iMOGABA9 86 GHz hybrid maps of the sources that could be not imaged with standard procedures, but were successfully imaged with FPT. Contours start at 3×RMS level.

iMOGABA II: Frequency Phase Transfer 11

(a) 0235+164 (b) 0528+134 (c) 0735+178

(d) 0827+243 (e) 0836+710 (f) 1127-145

(g) 1156+295 (h) 1222+216 (i) 1308+326

(j) 1343+451 (k) 1611+343 (l) 3C446 Figure 4. FPT visibility phases for iMOGABA9 observations at 129 GHz. Each data set was calibrated using the scaled solutions from the analysis of the same source at 22 GHz. Plots show temporal average of 30 seconds.

12 J. C. Algaba et al

(a) 0235+164 (b) 0528+134 (c) 0735+178

(d) 0827+243 (e) 0836+710 (f) 1127-145

(g) 1156+295 (h) 1222+216 (i) 1308+326

(j) 1343+451 (k) 1611+343 (l) 3C446 Figure 5. Same as Figure 4, but using the scaled solutions from the analysis of the same source at 43 GHz.

iMOGABA II: Frequency Phase Transfer 13

Figure 6. iMOGABA9 129 GHz hybrid maps of the sources that could be not imaged with standard procedures, but were successfully imaged with FPT.

14 J. C. Algaba et al

(a) 0235+164 (b) 0420–014 (c) 0727–115

(d) 0735+178 (e) 0827+243 (f) 0836+710

(g) 1510–089 (h) 1611+343 (i) 4C39.25

(j) CTA102 (k) NRAO530 Figure 7. FPT visibility phases for iMOGABA15 observations at 86 GHz. Each data set was calibrated using the scaled solutions from the analysis of the same source at 22 GHz. Plots show temporal average of 30 seconds.

iMOGABA II: Frequency Phase Transfer 15

(a) 0235+164 (b) 0420–014 (c) 0727–115

(d) 0735+178 (e) 0827+243 (f) 0836+710

(g) 1510–089 (h) 1611+343 (i) 4C39.25

(j) CTA102 (k) NRAO530 Figure 8. Same as Figure 7, but using the scaled solutions from the analysis of the same source at 43 GHz.

16 J. C. Algaba et al

(a) 0235+164 (b) 0420–014 (c) 0716+714

(d) 0727–115 (e) 0735+178 (f) 0827+243

(g) 0836+710 (h) 1510–089 (i) 1611+343

(j) 1749+096 (k) 1921-293 (l) 3C345 Figure 9. FPT visibility phases for iMOGABA15 observations at 129 GHz. Each data set was calibrated using the scaled solutions from the analysis of the same source at 22 GHz. Plots show temporal average of 30 seconds.

iMOGABA II: Frequency Phase Transfer 17

(m) 3C454.3 (n) 3C84 (o) 4C28.07

(p) 4C38.41 (q) 4C39.25 (r) BL Lac

(s) CTA102 (t) NRAO530 (u) OJ287 Figure 9. – Cont.

18 J. C. Algaba et al

(a) 0235+164 (b) 0420–014 (c) 0716+714

(d) 0727–115 (e) 0735+178 (f) 0827+243

(g) 0836+710 (h) 1510–089 (i) 1611+343

(j) 1749+096 (k) 1921-293 (l) 3C345 Figure 10. Same as Figure 9, but using the scaled solutions from the analysis of the same source at 43 GHz.

iMOGABA II: Frequency Phase Transfer 19

(m) 3C454.3 (n) 3C84 (o) 4C28.07

(p) 4C38.41 (q) 4C39.25 (r) BL Lac

(s) CTA102 (t) NRAO530 (u) OJ287 Figure 10. – Cont.