arXiv:1509.04578v1 [physics.optics] 15 Sep 2015

Enhancement of dynamic sensitivity of multiple surface-plasmonic-polaritonic sensor using silver nanoparticles

Farhat Abbas, Muhammad Faryad Department of Physics, Lahore University of Management Sciences, Lahore, 54792, Pakistan. Email: muhammad.faryad@lums.edu.pk

Stephen E. Swiontek, Akhlesh Lakhtakia Department of Engineering Science and Mechanics, Pennsylvania State University, University Park, Pennsylvania 16802, USA. Email: akhlesh@psu.edu

March 31, 2020

Abstract

Multiple surface plasmon-polariton (SPP) waves excited at the interface of a homogeneous isotropic metal and a chiral sculptured thin film (STF) impregnated with silver nanoparticles were theoretically assessed for the multiple-SPP-waves-based sensing of a fluid uniformly infiltrating the chiral STF. The Bruggemann homogenization formalism was used in two different modalities to determine the three principal relative permittivity scalars of the silver-nanoparticle-impregnated chiral STF infiltrated uniformly by the fluid. The dynamic sensitivity increased when silver nanoparticles were present, provided their volume fraction did not exceed about 1%.

1 Introduction

Optical sensors that rely on the variability of the excitation of a surface plasmonpolariton (SPP) wave guided by the planar interface of a metal and a homogeneous isotropic dielectric (HID) material with respect to the refractive index of the latter material are widely used to detect and quantify the concentrations of analytes [1, 2, 3]. At any given free-space wavelength λ_0 , only one SPP wave can be excited in a sensor of this kind [4] and can be used to detect a single analyte present in the HID material [2, 3].

Despite successes, strategies to economically [5] improve reliability continue to be devised. One strategy is to disperse a small volume fraction of metal nanoparticles in the HID material [6, 7, 8], which is usually a fluid for sensing applications. This strategy exploits the excitation of the Fröhlich mode [9] or a localized surface-plasmon resonance [10] in a metal nanoparticle by an SPP wave. Metal nanoparticles have been reported to increase the sensitivity, depending on the substrate as well as the shape and material of the nanoparticles [6, 7, 11, 12]. Also, metal nanoparticles are necessary to provide sites for recognition molecules that would bind to the specific analyte to be detected [13].

An emerging strategy is to replace the HID material by a periodically nonhomogeneous dielectric (PHD) material that is porous [14]. The planar interface of a metal and a PHD material is capable of guiding multiple SPP waves of the same frequency and direction of propagation but with different polarization states, phase speeds, spatial profiles, attenuation rates, and degrees of localization to the interface [15]. If the PHD material is porous, it can be infiltrated with the analyte to be sensed. Multiple SPP waves provide the opportunity for more reliable and more sensitive optical sensing than a single SPP wave. This has been established both theoretically and experimentally using sculptured thin films (STFs) as porous PHD materials [14, 16, 17]. However, the effect of infiltration of the STF by metal nanoparticles in a multiple-SPP-waves-based sensing scenario is not known.

Therefore, we set out to investigate multiple-SPP-waves-based sensing in which a chiral STF [18] is infiltrated by metal nanoparticles as well as a fluid. A chiral STF is an ensemble of parallel nanohelixes, and is therefore macroscopically conceptualized as an anisotropic and helically nonhomogeneous material in the optical spectral regime. We first determined the complex wavenumbers q of SPP waves in a canonical boundary-value problem in which a metal and a chiral STF occupy adjoining half spaces. Then we determined the angle of incidence θ_{inc} of light that is needed to excite an SPP wave in the Turbadar–Kretschmann– Raether prism-coupled configuration [15] employed for experiments.

The plan of this paper is as follows: Sec. 2.1 describes the calculation of three nanoscale parameters by using the inverse Bruggeman homogenization formalism and the use of the forward Bruggeman homogenization formalism to determine the constitutive parameters of the chiral STF [16] in which silver nanoparticles are placed and whose void regions are in infiltrated by a fluid. In Sec. 3, numerical results of the canonical boundary-value problem and the prism-coupled configuration are presented and discussed. Concluding remarks are presented in Sec. 4. An exp(−iωt) dependence on time t is implicit, where ω is the angular frequency and i = √ −1. The Cartesian unit vectors are denoted by û_x, û_y, and û_z; dyadics are double underlined; vectors are in bold face; and the free-space wavenumber and wavelength are denoted by k_0 = ω √ ε_0μ_0 and λ_0 = 2π/k_0, respectively, where μ_0 is the permeability of free space and ε_0 is the permittivity of free space.

2 Theory in Brief

2.1 Microscopic-to-continuum model for chiral STFs

Chiral STFs are usually fabricated using physical vapor deposition by directing a vapor flux towards a rotating substrate at an angle χ_v [18]. The angle χ_v, the deposition rate, and the rotation speed of the substrate are the main factors on which the porosity of the chiral STF depends. The relative permittivity dyadic of a chiral STF is stated as

ε_{Chi ST F} (z) = S_z(z) · S_y(χ) · ε^∘_{ref} · S^{−1}_y (χ) · S^{−1}_z (z) , (1)

with the dyadics

S_z(z) = û_zû_z + (û_xû_x + û_yû_y) cos(hπz/Ω)

+ (û_yû_x − û_xû_y) sin(hπz/Ω) S_y(χ) = û_yû_y + (û_xû_x + û_zû_z) cos χ

+ (û_zû_x − û_xû_z) sin χ ε^∘_{ref} = ε_aû_zû_z + ε_bû_xû_x + ε_cû_yû_y

; (2)

where the direction of helical nonhomogeneity is parallel to the z axis, χ ∈ (0, π/2] is the angle of rise of the nanohelixes in the chiral STF with respect to the xy plane, 2Ω is the helical period, and h = +1 for structural right handedness but h = −1 for structural left handedness.

The three principal relative permittivity scalars ε_a, ε_b, and ε_c will be different for an as-deposited chiral STF than for a chiral STF containing the metal nanoparticles and/or infiltrated by a fluid. The process to determine these quantities for the present work relies on both experimental data and a theoretical microscopic-to-continuum model [16]. The as-deposited chiral STF is supposed to be made of a material of refractive index n_s, this material assumed to be deposited in the form of electrically small ellipsoids with a transverse aspect ratio γ_b somewhat larger than unity and a slenderness ratio γ_τ ≫ 1; i.e., every nanohelix is a string of ellipsoidal sausages. The volume fraction of the deposited material is denoted by f_s ∈ [0, 1]. The void regions are thought of as electrically small spheres of unit refractive index. The metal nanoparticles are assumed to be electrically small spheres of refractive index n_{np}. The fluid is taken to be distributed as electrically small spheres of refractive index n_ℓ.

As discussed elsewhere [16], h is fixed during deposition, while Ω and χ can be determined from scanning electron micrographs of the as-deposited chiral STF. Let ε_a = ε_{a1}, ε_b = ε_{b1}, and ε_c = ε_{c1} for the as-deposited chiral STF. With the assumptions that (i) ε_{a1,b1,c1} have been measured through optical experiments, (ii) γ_τ = 15, and (iii) the as-deposited chiral STF is a composite material comprising the deposited material and air, the inverse Bruggeman formalism can be employed to determine n_s, f_s, and γ_b [16]. Let us note that the effect of increasing γ_τ beyond 10 is insignificant [15].

Suppose next that ε_a = ε_{a2}, ε_b = ε_{b2}, and ε_c = ε_{c2} for a chiral STF uniformly infiltrated by metal nanospheres and/or fluid nanospheres. The volume fraction of the metal is denoted by f_{np} ∈ [0, 1], while that of the fluid is denoted by f_ℓ = 1 − f_{np} − f_s ∈ [0, 1]. With n_s, f_s, γ_b, and f_{np} known, ε_{a2,b2,c2} can be determined using the forward Bruggeman formalism [19]. Obviously, f_{np} = 0 if there are no metal nanoparticles [15, 16]. Furthermore, if the fluid is absent, we have to set n_ℓ = 1 while implementing the forward Bruggeman formalism.

2.2 Canonical boundary-value problem

In order to formulate the canonical problem for SPP wave propagation [15], we take the half space z < 0 to be wholly occupied by a metal of refractive index n_{met} and the half space z > 0 by the chiral STF, as shown in Fig. 1(a).

(a) (b)

Figure 1: Schematics of (a) the canonical boundary-value problem, and (b) the Turbadar–Kretschmann–Raether prism-coupled configuration.

The SPP wave is taken to propagate parallel to the unit vector û_{prop} = û_x cos ψ + û_y sin ψ, ψ ∈ [0, 2π), in the xy plane and to decay far away from the interface z = 0. The electric and magnetic field phasors can be written everywhere as

E(x, y, z) = e(z) exp[iq(x cos ψ + y sin ψ)]

H(x, y, z) = h(z) exp[iq(x cos ψ + y sin ψ)] } , z ∈ (−∞, ∞) , (3) where the complex-valued wavenumber q and the vector functions e(z) and h(z) are not known. The procedure to obtain a dispersion equation for q is provided in detail elsewhere [15, Chap. 3], and so is the procedure to determine the functions e(z) and h(z) for each solution q of the dispersion equation.

2.3 Prism-coupled configuration

The prism-coupled configuration shown in Fig. 1(b) is practically implementable. Light of fixed polarization state and free-space wavelength λ_0 is incident on the semicircular face of the prism at an angle θ_{inc}, the refractive index of the prism being denoted by n_{prism}. The base of the prism is coated with a metal layer of thickness L_{met} and refractive index n_{met}. The other face of metal layer is in intimate contact with a chiral STF of thickness L_d, beyond which is a half space occupied by the fluid. With I_{inc} as the intensity of light inside the prism impinging upon the prism/metal interface and I_{ref} as the intensity of light inside the prism reflected by the prism/metal interface, the detailed procedure to determine the ratio R = I_{ref} /I_{inc} is available elsewhere [15].

The minimums of R are identified as the angle θ_{inc} ∈ [0, π/2) is varied. If a certain minimum occurs at the same value θ_{SPP} of θ_{inc} for all L_d greater than some threshold value while no transmission occurs in to the half space occupied by the fluid, an SPP wave guided by the metal/chiral-STF interface is said to be excited. Then,

θ_{SPP} = sin^{−1} [ Re (q) k_0 n_{prism} ] (4) ideally, where q is a solution of the dispersion equation of the canonical boundaryvalue problem.

3 Numerical Results and Discussion

For all numerical results presented in this paper, we fixed λ_0 = 633 nm and set ε_{a1} = 3.2589, ε_{b1} = 4.4571, ε_{c1} = 3.7829, and χ = 58.9928^∘, in accord with previous works [15, 16, 20]. The inverse Bruggeman formalism yields n_s = 3.0517, f_s = 0.5039, and γ_b = 1.8381 [16]. We also chose h = 1, Ω = 200 nm, n_{prism} = 2.6 (zinc selenide), n_{met} = 1.3799+7.6095i (aluminum), L_{met} = 15 nm, and n_{np} = 0.0562 + 4.2776i (silver). Without significant loss of generality, we fixed ψ = 0. The parameters L_d, f_{np}, and n_ℓ ∈ [1, 1.5] were kept as variables. We confined the search for solutions to Re(q)/k_0 ∈ [1, 3].

3.1 Chiral STF without nanoparticles (f_{np} = 0)

In order to assess the effects of metal nanoparticles residing inside a chiral STF, let us begin with the sensing of a fluid when f_{np} = 0 [16].

The real and imaginary parts of the relative wavenumbers q/k_0 are plotted in Fig. 2 as functions of the refractive index n_ℓ ∈ [1, 1.5]. All solutions of the dispersion equation for SPP waves are organized in three branches labeled ‘1’, ‘2’, and ‘3’. The branches differ in the ranges of both the phase speed v_{ph} = ω/Re(q) and the propagation distance Δ_{prop} = 1/Im(q) in the xy plane. Values of θ_{SPP} and the dynamic sensitivity [1] ρ = dθ_{SPP}(n_ℓ) dn_ℓ (5) for all three branches are plotted against n_ℓ in Fig. 3, which shows that (i) θ_{inc} is very sensitive to changes in n_ℓ and (ii) ρ can be as high as 30 deg/RIU (branch 3).

(a) (b)

Figure 2: (a) Real and (b) imaginary parts of q/k_0 plotted against n_ℓ when f_{np} = 0. The solutions found were organized in three branches labeled ‘1’, ‘2’, and ‘3’.

(a) (b)

Figure 3: (a) θ_{SPP} predicted for the prism-coupled configuration by using the data of Fig. 2 in Eq. (4), and (b) the dynamic sensitivity ρ as a function of n_ℓ for each branch when f_{np} = 0. The acronym RIU stands for “refractive-index unit”.

When n_ℓ = 1.33 (water), then SPP waves are predicted to be excited at θ_{SPP} ∈ {33.6^∘, 49.2^∘, 61.5^∘} in the prism-coupled configuration, according to Fig. 3(a). Figure 4 presents the reflectances R_p and R_s as functions of θ_{inc} for incident p- and s-polarized light, respectively, when L_d ∈ {4Ω, 6Ω, 8Ω}. From Fig. 4(a), we conclude that SPP waves are excited at θ_{inc} ∈ {33.5^∘, 49.2^∘, 62.5^∘} because the angular locations of the minimums of R_p are very weakly dependent on L_d when that thickness is large enough. We have also confirmed that these angular locations do not change if L_{met} is increased from 15 nm to 20 nm. Similarly, from Fig. 4(b) we conclude that incident s-polarized light is able to excite an SPP wave at θ_{inc} = 49.3^∘. Thus, the predictions from the canonical boundary-value problem match the conclusions one can draw for the prism-coupled configuration.

(a) (b)

Figure 4: Reflectances (a) R_p and (b) R_s as functions of θ_{inc} for L_d ∈ {4Ω, 6Ω, 8Ω}, when f_{np} = 0 and n_ℓ = 1.33. The arrows indicate the minimums that represent the excitation of SPP waves.

3.2 Chiral STF with silver nanoparticles (f_{np} > 0)

Let us now present results for f_{np} > 0, i.e., when the chiral STF contains silver nanoparticles. In practice, f_{np} must be very small or the chiral STF would become highly conducting, leading to the disappearance of SPP waves. For theoretical work, f_{np} must be very small or the Bruggeman formalism will yield unphysical results [19, 21].

(a) (b)

Figure 5: Same as Fig. 2 except that the volume fraction of silver nanoparticles is f_{np} = 0.01.

Figure 5 presents the real and imaginary parts of q/k_0 when f_{np} = 0.01. Just as for f_{np} = 0 in Fig. 2, three branches of SPP waves exist in Fig. 5. The presence of the silver nanoparticles tends to reduce both the phase speed v_{ph} and the propagation distance Δ_{prop}. Even more significantly, the higher-v_{ph} branches 1 and 2 terminate at lower values of n_ℓ when the silver nanoparticles are present.

Figure 6 provides the predicted values of θ_{SPP} and ρ when f_{np} = 0.01. As indicated by Eq. (4) and confirmed by a comparison of Figs. 3 and 6, SPP waves should be excited by less obliquely incident light when the silver nanoparticles are present. However, the maximum ρ increases from about 30 deg/RIU in

(a) (b)

Figure 6: Same as Fig. 3 except that the volume fraction of silver nanoparticles is f_{np} = 0.01.

Fig. 3(b) for f_{np} = 0 to about 69 deg/RIU in Fig. 6(b) for f_{np} = 0.01 for branch 3.

When n_ℓ = 1.33, Fig. 6(a) indicates that SPP waves can be excited at θ_{SPP} ∈ {54.3^∘, 67.9^∘} in the prism-coupled configuration. Thus, the number of SPP waves predicted reduces by unity when 1% volume of chiral STF is occupied by the silver nanoparticles. This reduction is confirmed by the plots of R_p versus θ_{inc} in Fig. 7(a), the minimums of R_p indicating SPP-wave excitation being located at θ_{inc} ∈ {54.3^∘, 68.4^∘}. Moreover, incident s-polarized light can excite an SPP wave at θ_{inc} = 54.3^∘, according to Fig. 7(b).

(a) (b)

Figure 7: Same as Fig. 4 except that the volume fraction of silver nanoparticles is f_{np} = 0.01.

To find the sweet spot for the highest but practical value of the dynamic sensitivity ρ, we have mapped it as a function of f_{np} and n_ℓ in Figs. 8-10 for the three branches of the solutions. We chose n_ℓ ∈ [1.3, 1.6], since most liquids have refractive index in this range.

Figure 8 shows that, on branch 1, SPP waves exist only when f_{np} ≤ 0.004 to detect liquids with n_ℓ ∈ (1.3, 1.6) and the change in ρ is very small. For the chosen prism and the chiral STF, the SPP waves on this branch are excited with θ_{SPP} ∈ [∼ 33^∘, ∼ 41^∘]. Figure 9 shows that on branch 2, (i) ρ can increase from about 22 deg/RIU to 46 deg/RIU and (ii) the detection over the entire

Figure 8: The dynamic sensitivity ρ as a function of the refractive index n_ℓ of the fluid and the volume fraction f_{np} of silver nanoparticles for solutions on branch 1 in Figs. 2 and 5.

Figure 9: Same as Fig. 8 except for branch 2.

Figure 10: Same as Fig. 8 except for branch 3.

chosen range of n_ℓ is possible only with f_{np} ≤ 0.008 with a maximum ρ of about 35 deg/RIU. Furthermore, the SPP waves on branch 2 are excited with θ_{SPP} ∈ [∼ 49^∘, ∼ 65^∘]. Finally, Fig. 10 that on branch 3, (i) ρ can increase up to 135 deg/RIU, and (ii) the detection over the full chosen range of n_ℓ is possible only with f_{np} ≤ 0.008 with a maximum ρ of about 98 deg/RIU. The SPP waves on branch 3 are excited with θ_{SPP} ∈ [∼ 65^∘, ∼ 85^∘].

3.3 Chiral STF with absorbing dielectric nanoparticles

To see if the enhancement of dynamic sensitivity is due to absorption loss induced by silver nanoparticles in the chiral STF or if it is due to the negative real part of the permittivity of the silver nanoparticles, we computed ρ when the silver nanoparticles of relative permittivity (0.0562 + 4.2776i)^2 = −18.2947+0.04808i are replaced by absorbing dielectric nanoparticles of relative permittivity (4.2776 + 0.0562i)^2 = 18.2947 + 0.4808i. The data for f_{np} = 0.01 are shown in Fig. 11. A comparison of this figure with Figs. 3(b) and 6(b) shows that the dynamic sensitivity is unaffected by the deployment of the absorbing dielectric nanoparticles—in contrast to the deployment of the same volume fraction of silver nanoparticles.

3.4 Chiral STF with gold nanoparticles

Also, we performed calculations with gold nanoparticles (n_{np} = 0.1834+3.4332i) deployed instead of silver nanoparticles, while f_{np} = 0.005 fixed and n_ℓ ∈ [1, 1.5] variable. Branch 3 disappeared. The enhancement of dynamic sensitivity was negligible with gold nanoparticles, with the maximum value of ρ being 24 deg/RIU for branch 1 and 26 deg/RIU for branch 2. These values of maximum ρ are much lower than those obtained with 0.5% volume fraction of silver nanoparticles: 54 deg/RIU for branch 1, 29 deg/RIU for branch 2, and 24 deg/RIU for branch 3.

Figure 11: Same as Fig. 6(b), except that silver nanoparticles of relative permittivity −18.2947 + 0.04808i are replaced by absorbing dielectric nanoparticles of relative permittivity 18.2947 + 0.4808i.

4 Concluding remarks

The multiple-SPP-waves-based sensing of a fluid uniformly infiltrating a chiral STF impregnated with metal nanoparticles was studied theoretically, when the chiral STF is deployed in the prism-coupled configuration [1]. Comparison was made with the case when the nanoparticles are absent [16]. The Bruggemann homogenization formalism was used in two different ways to model the three principal relative permittivity scalars of the metal-nanoparticle-impregnated chiral STF flooded by the fluid.

The main conclusion was that the dynamic sensitivity of the SPP-wave-based optical sensor can increase significantly when the chiral STF is impregnated with silver nanoparticles, provided that the silver volume fraction does not exceed about 1%. The enhancement in the dynamic sensitivity is not due to the absorption introduced by the silver nanoparticles, and should be attributed to the local-field enhancement due to the metal nanoparticles [10] and the possible interaction of particle plasmon-polaritons and surface plasmon-polaritons [11, 12]. Gold nanoparticles did not enhance dynamic sensitivity as well as silver nanoparticles.

References

[1] Homola J (2003) Present and future of surface plasmon resonance biosensors. Anal. Bioanal. Chem. 377:528–539

[2] Abdulhalim I, Zourob M, Lakhtakia A (2008) Surface plasmon resonance for biosensing: A mini-review. Electromagnetics 28:214–242

[3] Couture C, Zhao S S, Masson J-F (2013) Modern surface plasmon resonance for bioanalytics and biophysics. Phys. Chem. Chem. Phys. 15:11190–11216

[4] Maier SA (2007) Plasmonics: Fundamentals and Applications. Springer, New York

[5] Luong JHT, Male KB, Glennon JD (2008) Biosensor technology: Technology push versus market pull. Biotechnol. Adv. 26:492–500

[6] Hutter E, Cha S, Liu J-F, Park J, Yi J, Fendler JH, Roy D (2001) Role of substrate metal in gold nanoparticle enhanced surface plasmon resonance. J. Phys. Chem. 105:8–12

[7] Hao P, Wu Y, Li F (2011) Improved sensitivity of wavelength-modulated surface plasmon resonance biosensor using gold nanorods. Appl. Opt. 50:5555–5558

[8] Bedford EE, Spadavecchia J, Pradier C-M, Gu FX (2012) Surface plasmon resonance biosensors incorporating gold nanoparticles. Macromol. Biosci. 12:724–739

[9] Bohren CF, Huffman DR (1983) Absorption and Scattering of Light by Small Particles. Wiley, New York

[10] Kalele SA, Tiwari NR, Gosavi SW, Kulkarni SK (2007) Plasmon-assisted photonics at the nanoscale. J. Nanophoton. 1:012501

[11] Lee K-S, El-Sayed MA (2006) Gold and silver nanoparticles in sensing and imaging: Sensitivity of plasmon response to size, shape, and metal composition. J. Phys. Chem. 110:19220–19225

[12] Li A, Isaacs S, Abdulhalim I, Li S (2015) Ultrahigh enhancement of electromagnetic fields by exciting localized with extended surface plasmons. J. Phys. Chem. C 119:19382–19389

[13] Saha K, Agasti SS, Kim C, Li X, Rotello VM (2012) Gold nanoparticles in chemical and biological sensing. Chem. Rev. 112:2739–2779

[14] Swiontek SE, Pulsifer DP, Lakhtakia A (2013) Optical sensing of analytes in aqueous solutions with a multiple surface-plasmon-polariton-wave platform. Sci. Rep. 3:1409

[15] Polo JA Jr, Mackay TG, Lakhtakia A (2013) Electromagnetic Surface Waves: A Modern Perspective. Elsevier, Waltham, MA

[16] Mackay TG, Lakhtakia A (2012) Modeling chiral sculptured thin films as platforms for surface-plasmonic-polaritonic optical sensing. IEEE. Sens. J. 12: 273–280

[17] Abbas F, Naqvi QA, Faryad M (2015) Multiplasmonic optical sensor using sculptured nematic thin films. Plasmonics. DOI: 0.1007/s11468-015-9920-7

[18] Lakhtakia A, Messier R (2005) Sculptured Thin Films: Nanoengineered Morphology and Optics. SPIE Press, Bellingham, WA

[19] Lakhtakia A (2007) Toward optical sensing of metal nanoparticles using chiral sculptured thin films. J. Nanophoton. 1:019502

[20] Hodgkinson I, Wu Qh, Hazel J (1998) Empirical equations for the principal refractive indices and column angle of obliquely deposited films of tantalum oxide, titanium oxide, and zirconium oxide. Appl. Opt. 37:2653–2659

[21] Mackay TG (2007) On the effective permittivity of silver-insulator nanocomposites. J. Nanophoton. 1:019501