arXiv:1509.00037v2 [astro-ph.EP] 13 Oct 2015

Spitzer IRAC Photometry for Time Series in Crowded Fields

S. Calchi Novati^{1,2,3,a}, A. Gould^4, J. C. Yee^{5,b}, C. Beichman^1, G. Bryden^6, S. Carey^7, M. Fausnaugh^4, B. S. Gaudi^4, C. B. Henderson^{6,4,c}, R. W. Pogge^4, Y. Shvartzvald^{6,c}, B. Wibking^4, W. Zhu^4 (Spitzer team) and A. Udalski^8, R. Poleski^4, M. Pawlak^8, M. K. Szymański^8, J. Skowron^8, P. Mróz^8, S. Kozłowski^8, Ł. Wyrzykowski^8, P. Pietrukowicz^8, G. Pietrzyński^8, I. Soszyński^8, K. Ulaczyk^9 (OGLE group)

ABSTRACT

We develop a new photometry algorithm that is optimized for Spitzer time series in crowded fields and that is particularly adapted to faint and/or heavily blended targets. We apply this to the 170 targets from the 2015 Spitzer microlensing campaign and present the results of three variants of this algorithm

1NASA Exoplanet Science Institute, MS 100-22, California Institute of Technology, Pasadena, CA 91125, USA 2Dipartimento di Fisica “E. R. Caianiello”, Università di Salerno, Via Giovanni Paolo II, 84084 Fisciano (SA), Italy

3Istituto Internazionale per gli Alti Studi Scientifici (IIASS), Via G. Pellegrino 19, 84019 Vietri Sul Mare (SA), Italy

4Department of Astronomy, Ohio State University, 140 W. 18th Ave., Columbus, OH 43210, USA

5Harvard-Smithsonian Center for Astrophysics, 60 Garden St., Cambridge, MA 02138, USA

6Jet Propulsion Laboratory, California Institute of Technology, 4800 Oak Grove Drive, Pasadena, CA 91109, USA

7Spitzer, Science Center, MS 220-6, California Institute of Technology,Pasadena, CA, USA

8Warsaw University Observatory, Al. Ujazdowskie 4, 00-478 Warszawa,Poland

9Department of Physics, University of Warwick, Gibbet Hill Road, Coventry, CV4 7AL, UK

aSagan Visiting Fellow

bSagan Fellow

cNASA Postdoctoral Program Fellow

– 2 –

in an online catalog. We present detailed accounts of the application of this algorithm to two difficult cases, one very faint and the other very crowded. Several of Spitzer’s instrumental characteristics that drive the specific features of this algorithm are shared by Kepler and WFIRST, implying that these features may prove to be a useful starting point for algorithms designed for microlensing campaigns by these other missions.

Subject headings: gravitational lensing: micro – techniques: photometric

1. Introduction

The IRAC camera on the Spitzer observatory has been employed in a vast array of scientific investigations, including some that were not imagined at the time it was launched in 2003, much less when it was conceived in the 1980s. Perhaps the most famous of these is the measurement of differential exo-planet transit depth as a function of wavelength, which requires exquisite photometric precision in order to probe the exo-atmospheres (Charbonneau et al. 2005; Deming et al. 2005). These and other applications have stimulated the development of new photometric techniques and pipelines.

In the last two years, Spitzer has taken on a completely new role as a “microlens parallax satellite” (Refsdal 1966). Although this application was suggested prior to launch (Gould 1999), and even carried out for one event (OGLE-2005-SMC-001, Dong et al. 2007), the photometric advances required to meet this role were not even basically understood until data were collected from the 2014 “pilot program”: 100 hours of Director’s Discretionary Time that were granted to assess the feasibility of Spitzer microlens parallaxes. These data revealed that while standard (Spitzer or other) photometric packages returned reasonably good photometry for most bright events (Udalski et al. 2015a; Yee et al. 2015a; Calchi Novati et al. 2015; Zhu et al. 2015a), these packages usually failed, often catastrophically, for faint events.

After 832 hours were awarded for the 2015 season (i.e., the majority of the 38 days for which Spitzer can observe Galactic bulge microlensing fields during microlensing season), Yee et al. (2015b) developed detailed protocols to optimize efficiency to achieve the program’s primary aim of measuring the “Galactic distribution of planets”. Of course, one of the key parameters in these protocols was an estimate of the IRAC 3.6 μm threshold at which one could expect reliable Spitzer photometry. Yee et al. (2015b) reviewed the results from various photometric packages as applied to the 2014 campaign to establish a threshold assuming no

– 3 –

further improvements, which they parameterized by a 3.6μm flux indicator^1 L_{eff} = 15.5. They also analyzed the reasons for the shortcomings of existing packages when applied to this data set and reported in outline the ongoing work (now presented in the current paper) to resolve these shortcomings.

One of the key points made by Yee et al. (2015b) was that the selection of targets had to balance two critical indicators, encapsulated in a “quality factor”, which sums over all observed events, i, Q = ∑ i S_iP_i (1)

where S_i is the planet sensitivity and P_i is the probability that the observations would return a reliable microlens parallax (which of course requires reliable Spitzer photometry). This implied that events with exceptional sensitivity (large S_i) should be observed despite great risk (low P_i) that they would be too faint by the time Spitzer observed them, which could be from three to 10 days after they were recognized as sensitive to planets based on their ground-based light curves (Figure 1 of Udalski et al. 2015a).

The main class of such ultra-sensitive events is high-magnification events (Griest & Safizadeh 1998; Gould et al. 2010), which in most cases cannot be predicted until a few days before peak. Hence, in most cases, by the time that Spitzer observed such a high-magnification event it would already be well past peak and therefore very faint. Acting on the basis of Equation (1), however, the Spitzer microlens team typically attempted to observe such high magnification events even when the expected 3.6 μm flux was well below the threshold identified by Yee et al. (2015b). In fact, seven high-magnification events (with peak magnifications A > 100) were observed, which greatly exceeded expectations. This also greatly increased the stakes of improving the photometric performance at faint flux levels.

More generally, Spitzer microlens targets can be subject to extreme crowding, which can critically impact the photometry of these sources even when they are relatively bright. This can in turn adversely affect a range of applications from measuring microlens parallaxes to using the Spitzer light curves themselves to detect planets (Gould & Horne 2013)

The protocol for the target selection for the 2015 Spitzer campaign is described in detail in Yee et al. (2015b). A key point is that Spitzer targets can be chosen ”objectively” or ”subjectively”, according to which they fulfill, or not, a set of specified criteria. This is relevant first to establish the cadence of the observations and second to frame the analysis of the planet sensitivity.

1L_{eff} = I − 0.93 A_I − 1.3 + 0.5Θ(I − A_I − 17.2), where Θ is a step function and A_I is the extinction.

– 4 –

In Section 2, we review the challenges to obtaining excellent time series photometry in crowded fields with Spitzer using existing packages, and we outline our algorithm for meeting these challenges. In Section 3, we discuss present applications of this algorithm to two examples of the difficult conditions encountered while pursuing the above scientific objectives. In Section 4, we describe an online catalog of photometry from our pipeline for all of the 170 events observed by Spitzer in the 2015 campaign. As we note there, it may often be possible to improve on this pipeline photometry for individual events of special scientific interest. The first author should therefore be contacted regarding applications of this photometry. Finally, in Section 5, we discuss some future implications of this work.

2. Challenges to Crowded Field Photometry with Spitzer

There are broadly two classes of routines applicable to time series photometry in crowded fields using electronic detectors: multi-object point spread function (PSF) photometry (MOPSF) and difference imaging analysis (DIA).

MOPSF (e.g., DoPhot, Schechter et al. 1993) was originally designed to disentangle stars in single-epoch images of crowded fields, such as globular clusters. Once an ensemble of point sources is identified, they are fit either individually, or in groups to an ensemble of overlapping PSFs. In principle, this routine can be applied to a time series by simply repeating the operation on many frames and cross-identifying point sources. However, if the cadence is high (so that the stars can be approximated as not moving between epochs), then the stability of the results can be improved by enforcing fixed positions on the stars. This is particularly relevant for applications such as microlensing in which one star may substantially change brightness while the others remain roughly constant. In that case, if the star positions are not held fixed, they may drift under the influence of changing flux ratios of overlapping PSFs, including unresolved (i.e., unmodeled) blends.

DIA (e.g., Alard & Lupton 1998) works by a completely different principle. No attempt is made to identify stars. Rather, an essentially noise-free template is created by stacking good-seeing images. Each image in the series is then aligned photometrically and geometrically with the template, and the template is convolved with a kernel to make its PSF similar to that of the current image. Then the current image is subtracted from the convolved template. Stars that have varied then appear as PSF bumps or divots. Usually these are isolated and so can easily be centroided and then multiplied by the PSF to yield a photometric measurement. DIA has proved so far superior to MOPSF that the latter is rarely used for time series photometry in crowded fields. At the same time, however, it is obviously useless for photometry of constant stars since these simply disappear from the difference images.

– 5 –

Neither of these techniques is suitable for the analysis of faint variable targets in crowded Spitzer images.

For the Spitzer microlensing campaign we use channel 1 (at 3.6μm) of the IRAC camera (Fazio et al. 2004) with mean pixel scale 1.221^{′′} and mean FWHM 1.66^{′′}, with the image quality being limited primarily by the telescope optics. Given our goal of performing pointsource photometry in a crowded field, it is important to note that the PSF is undersampled and that there is a significant variation in sensitivity within pixels (i.e., with the “pixel phase”, Ingalls et al. 2012). To address these issues the Spitzer Science Center developed an approach based on Point Response Functions (PRFs) specific for IRAC (a technique previously developed for the WFPC2 and NICMOS on the Hubble Space Telescope, Lauer 1999; Anderson & King 2000). These are meant to combine information about the PSF, the detector sampling, and the intrapixel sensitivity variation^2. The Spitzer Science Center has also developed a specific package, MOPEX (Makovoz & Marleau 2005), to deal with the various aspects of the Spitzer instruments image analysis, and specifically for the photometry of point sources for IRAC.

We pause to note why the standard MOPSF and DIA packages are bound to fail, at least in the more difficult situations of low signal-to-noise ratio (S/N) and/or crowding. DIA does not work because it implicitly assumes a uniform pixel response, a condition that is not met for IRAC. MOPSF also does not work, but not for such a fundamental reason. The underlying logic of standard MOPSF is actually very similar to MOPEX, but it is not built to deal with the PRFs. In this sense MOPEX can be considered a specialized variant of MOPSF.

For Spitzer microlensing observations, each “epoch” of a given target is composed by six 30s exposures, each dithered by a few arcsec. The Spitzer pipeline (in particular, MOPEX) provides, in addition to these single frames, also a mosaic of the dithers of a given epoch. We remark that a PRF analysis only makes sense when applied to the single frame images. This information is blurred away in the mosaic frames, which come, on the other hand, with a higher S/N and look similar to optical CCD images. Standard photometry techniques, such as aperture photometry, MOPSF, and DIA can be applied to these images, and for bright and/or isolated stars the results can be passable to good. However, for faint stars in more crowded situations the results can be poor to catastrophic.

Point-source photometry requires first, point-source extraction and second, flux determination. In our analysis we take advantage of two facts, which then requires us to update and refine the MOPEX approach, accordingly. First, we possess quite accurate prior knowl-

2http://irsa.ipac.caltech.edu/data/SPITZER/docs/dataanalysistools/tools/mopex/mopexusersguide/home/

– 6 –

edge of essentially all significant 3.6 μm sources on the frame. Second, we are dealing with a time series of images for which, as a working hypothesis, one can assume that only the microlensed source varies, with all other neighboring stars assumed constant, including those that are heavily blended with the microlensed source. (In principle, it is possible that a neighboring star can be a variable. However, it is straightforward to identify such stars from the residuals, and to grant them an extra flux parameter for each epoch instead of imposing a single constant-flux parameter.)

As foreshadowed, for point-source photometry, MOPEX works according to essentially the same principles as DoPhot, but with the specialized feature of employing PRFs. In essence, the photometry procedure is a fit based on a χ^2 minimization where the signal, over the area of interest (a few pixels around each target), is modeled as a background term plus a linear sum of the PRFs of the different sources contributing to each pixel. There are therefore 3 free parameters for each source: an amplitude term, which multiplies the corresponding PRF, and a pair of coordinates specifying the source centroid. As a technical point we note that the PRF is sampled at 5 × 5 = 25 pixel phase positions, i.e., five steps across the pixel in each direction. This is the basis for interpolating the PRF at each specific pixel phase^3. MOPEX can perform this fitting scheme working on single frames individually or on multiple frames simultaneously, including frames belonging to different epochs. From our standpoint, the drawback of MOPEX is its rigidity: it does not allow us to take advantage of the two aforementioned facts specific to our problem. In particular, the only choice permitted by MOPEX is whether to leave the background term as a free parameter. The flux and positions of all the stars involved must always be fitted, which in our case means for each individual epoch (since the microlensed source flux changes with epoch). For this reason PRF-fitting MOPEX indeed works well with our data for sufficiently isolated and/or bright sources. However, especially for faint stars, it sometimes cannot locate the star at all, or if it can, incorrectly locates the centroid due to confusion of blended objects and so applies the wrong PRF. Or, what is potentially worse, as the microlensed source gets brighter and fainter, MOPEX shifts its estimate of the centroid, leading to systematic errors that vary with changing brightness. For the 2014 campaign, MOPEX worked reasonably well for about half of the sample. It worked poorly for about one quarter of the sample and failed catastrophically for the remaining quarter. MOPEX fared much worse on the 2015 sample because the microlensed sources were overall substantially fainter.

3In the current analysis we make use of the publicly available cold-mission PRFs. These are however expected to have changed since 2009 when Spitzer entered its warm-mission operational phase (Storrie-Lombardi & Dodd 2010). We have tested our algorithm using a preliminary version of the warmmission PRFs (J. Ingalls, private communication) and we do not find substantial differences in the output photometry.

– 7 –

From an algorithmic standpoint, the path to resolving the difficulties faced by MOPEX is straightforward: apply the same improvements made to DoPhot and other MOPSF packages when they graduated from single-epoch to time-series applications. First, one should hold the brightness of all stars fixed from epoch to epoch (after establishing that they are not in fact variable). Second, one should (usually) hold fixed the angular offsets between all stars from one epoch to the next.

Implementation of the first (photometric) constraint is straightforward. If there are N epochs, n non-varying stars in the neighborhood of the lens, and m ≥ 1 varying stars (including the lens), then there are a total of n + mN + 1 photometric parameters (including one for the background).

However, it is not obvious how to implement the second (astrometric) constraint, or even whether to do so. At the outset, prior to and independently from the photometric analysis, we build a relative astrometric solution to link the OGLE (or in some cases, MOA) catalog coordinates^4 to the Spitzer pixel coordinates, and this for each one of the 6N IRAC frames. In one case (Method 2, below) we additionally need a relative astrometric solution between an arbitrarily chosen IRAC “reference” frame and the other IRAC frames.

The great majority of 3.6 μm sources in most microlensing fields are known with good astrometric precision from OGLE catalogs, which have much better resolution than Spitzer. A first approach is simply to adopt these positions. In this case, we determine the positions of each star in each Spitzer frame, including the microlensing source, from a local ensemble of reference-star triangles.

Second, one can use the OGLE positions as inputs to derive the IRAC positions from a simultaneous fit to all frames. Then there are (6qN +2(n+m)) parameters, i.e., some number q ≥ 6 frame-transformation parameters for each of the 6N images, which are applied prior to the analysis of each image, and the two-dimensional offsets of each star from a fiducial origin, which is held fixed for all 6N images. More specifically, to carry out the relative astrometry we make use of the IRAF package geomap with a polynomial non-linear transformation of order 5 to 8. The typical astrometric uncertainty that we achieve is about 0.1 pixel.

Finally, one can use the OGLE positions as inputs, but derive star positions on each frame separately. From the standpoint of astrometry, this is similar to what MOPEX does on a single frame (although it still differs from MOPEX in that it imposes a photometric

4All Spitzer targets are selected from ongoing microlensing events that have been publicly alerted by either the Optical Gravitational Lens Experiment (OGLE) or Microlensing Observations in Astrophysics (MOA) collaborations. Each OGLE alert is linked to a detailed photometric and astrometric catalog of neighboring stars.

– 8 –

constraint). In this case, there are 6N × 2(n + m) astrometric parameters.

In brief,

Method 1: Externally determined PRF centroid.

Method 2: Single PRF centroid from simultaneous fit to all epochs.

Method 3: Individually fitted PRF centroid for each frame.

We find that in the majority of cases, Method 2 works best, but Methods 1 and 3 do sometimes work better.

Specifically, if the microlensed source is extremely faint, there is almost no information in any of the images about the location of this source, so the OGLE information of this source position (which is very precise because it comes from astrometry of the difference image between when it is magnified and at baseline) is far superior to what can be obtained by fitting the IRAC images. Hence, Method 1 works best for these sources.

If the microlensed source has considerable signal even in just a subset of images, then PRF fits to its position are usually superior to those derived from the transformation from the OGLE frame. This is an empirical fact. Its cause is not completely understood but is most likely due to a combination of errors in the frame transformations and the different distributions of I band and 3.6μm light in these crowded fields. Hence, either Method 2 or Method 3 is better.

If the microlensed source is sometimes relatively bright and sometimes quite faint, then Method 2 works well but Method 3 fails because the lens position is “lost” on the fainter images. By the nature of the Spitzer microlensing campaign, this is true in the majority of cases. However, if the microlensed source is always bright, then Method 3 can work best, probably because it avoids the above-mentioned frame-transformation errors.

In conclusion, our approach to the photometry for the microlensing campaign is a variant of MOPEX, a χ^2 PRF-based minimization modeling of the signal^5, where we have introduced the freedom to keep some parameters fixed from epoch to epoch, while other parameters are allowed to vary. Specifically, we always keep all other star fluxes fixed, except for those determined to be variables. We usually keep all of the vector angular separations fixed (usually at values determined from a joint fit to the images, but sometimes by direct input from OGLE

5In its present version for the fit we make use of MINUIT (James & Roos 1975) within the CERNLIB package https://cernlib.web.cern.ch/cernlib/

– 9 –

astrometry). For a few events that remain bright throughout the Spitzer observations, we fit for the positions in each frame separately.

In a nutshell, we take advantage of the PRF-fitting procedure and at the same time of the specific features of microlensing and of available data.

3. Two Example Applications

We illustrate our algorithm with two examples, Spitzer targets OGLE-2015-BLG-1395 and OGLE-2015-BLG-0029. These are chosen because they present conditions that are challenging in substantially different ways.

Applications of our algorithm to two other events have already been published, the planetary event OGLE-2015-BLG-0966 (Street et al. 2015), and the binary event with a massive-remnant candidate OGLE-2015-BLG-1285 (Shvartzvald et al. 2015). We note that the case of OGLE-2015-BLG-0966 is particularly interesting because the early light curve yielded satifactory photometry with Method 1, but not Method 2. However, later, when the event became brighter, Method 2 became much better (although still not quite as good as Method 1) because it was able to apply its “knowledge” of the microlensed source position from the brighter images to perform precise photometry on the fainter ones.

3.1. OGLE-2015-BLG-1395: High-Mag From Earth, Ultra-Faint From Spitzer

OGLE-2015-BLG-1395 was discovered by the Optical Gravitational Lens Experiment (OGLE) based on observations with the 1.4 deg^2 camera on its 1.3m Warsaw Telescope at the Las Campanas Observatory in Chile using its Early Warning System (EWS) real-time event detection software (Udalski et al. 1994; Udalski 2003) on 19 June UT 17:56. The Spitzer team contacted OGLE 21 hours later to get an early update on the next night of data and based on this immediately (20 June UT 14:30) alerted the microlensing community that this was a high-mag event. For results of this monitoring, see Cole et al. (2015). On 22 June, the event met the “objective criteria” for selection according to the protocols of Yee et al. (2015b) and was scheduled for observations at a cadence of 2/day for the first week and 1/day thereafter. The first Spitzer observations were three days later, HJD 7199.50, i.e., when the ground-based event was 5.3 days past peak and the event had already fallen to I = 18.6. In fact, when the Spitzer data are aligned to the OGLE scale (see below) the first point is at I = 19.0, corresponding to L_{eff} = 16.2, roughly 0.7 mag fainter than threshold set by Yee et al. (2015b). Hence, it was uncertain whether the parallax of this event could be recovered.

– 10 –

Figure 1 shows four reductions of the Spitzer data. MOPEX clearly fails. The reason for this failure is that it “finds” the source at ∼ 3–4^{′′} from its true position. Regarding the three variants of the new reductions, Method 1 is satisfactory, Method 2 works best, and Method 3 fails completely.

For many years it was believed that satellite parallax measurements required that the satellite observe the event over peak, or at least close enough to peak to determine the satellite-based impact parameter, u_{0,sat} (e.g., Gould 1995; Gaudi & Gould 1997). This is because satellite-based parallaxes π_E are basically determined from

π_E = AU D_⊥ (Δτ, Δβ); Δτ = t_{0,⊕} − t_{0,sat} t_E

; Δβ = ±u_{0,⊕} − ±u_{0,sat}, (2)

where the subscripts indicate parameters as measured from Earth and the satellite. Here, (t_0, u_0, t_E) are the standard point-lens microlensing parameters: time of maximum, impact parameter, and Einstein timescale, while D_⊥ is the Earth-satellite separation projected on the sky.

However, Yee et al. (2015b) argued that if the Spitzer source flux f_s could be independently measured (rather than fit from the Spitzer light curve as was previously believed necessary), then t_{0,sat} and u_{0,sat} could be determined even if the Spitzer data covered only a fragment of a post-peak light curve by making use of this independent determination of f_s together with the value of t_E measured from Earth. From Figure 1 it is clear that OGLE-2015-BLG-1395 provides an excellent way to test this idea.

To implement it, we first derive an estimate of the (I_{ogle} − L_{spitzer})_s color and then incorporate this directly into a joint fit to OGLE+Spitzer data. The general method for estimating (I − L)_s is to measure the source color in some ground-based bands X − I, then to determine an XIL (X − I vs I − L) color-color relation based on cross-identified field stars in ground and Spitzer images, and finally to apply this relation to the (X − L)_s color to derive (I − L)_s. For example, OGLE often has sufficient V -band data during the event to measure V − I from the ground-based light curve. Alternatively, if the fit to ground-based data shows that the source is unblended, then the baseline (V − I) color can be used as the source color. However, in the present case, the event peaked too rapidly to determine (V − I)_s from the normal cadence of OGLE V -band data.

We therefore use the simultaneous I and H data taken with the dual-channel ANDICAM camera on the 1.3m SMARTS telescope at CTIO, which acquired substantial data on almost all 2015 Spitzer microlensing events, primarily for exactly this purpose. Figure 2 shows a model-independent regression of these data, which yield (I − H)_{s,ctio} = −0.624 ± 0.007. We then form an IHL color-color diagram (Figure 3). We carry out the color-color regression on stars −0.5 < (I − H)_{ctio} < +0.2 in order to restrict the sample to warm (T > 4300 K) stars

– 11 –

that are in the bulge (and so behind the same column of dust), and find I_{ctio} − L_{spitzer} = 1.210(I − H)_{ctio} − 3.196 and hence (I_{ctio} − L_{spitzer})_s = −3.95. By regression, we obtain I_{ctio} − I_{ogle} = 0.73 and so finally (I_{ogle} − L_{spitzer})_s = −4.68. Here L = 25 − 2.5 log(F_{spitzer}) where F_{spitzer} is the instrumental flux shown in Figure 1 (three upper panels). We estimate an uncertainty of ±0.1 on this transformation. We report below on how the final results change with the adopted error bar. In both cases we exclude recursively the outliers, also indicated in the figure, from the regression analysis.

We apply this color constraint to a joint fit to OGLE and Spitzer data (Fig. 4), wherein the statistical error bars are renormalized so that χ^2/dof = 1 for each observatory. This is the standard procedure to account any possible additional scatter due to unmodeled systematics (this issue is further addressed in Sect. 4). Specifically, the size of the error bars is about 0.08 and 0.12 mag at the bright and the faint end, respectively. Actually, there are four possible fits, parameterized by ±u_{0,⊕} and ±u_{0,sat} as indicated by Equation (2). From the present standpoint of illustrating how Spitzer photometry is carried out and how external constraints are applied to the light curve, (t_0, u_0)_{sat} are the primary quantities of interest for these solutions. We find,

(t_0, u_0)_{++} = (7197.50, +0.280); (t_0, u_0)_{+−} = (7197.60, +0.282) (3) (t_0, u_0)_{−−} = (7197.48, −0.280); (t_0, u_0)_{−+} = (7197.60, −0.282), (4)

where the first and second subscripts refer to the signs of u_0 for Earth and Spitzer, respectively. That is, the naive idea that what is constrained by the Spitzer light curve is (t_0, |u_0|)_{sat} is confirmed, even though the light curve does not cover the peak. However, this is true only because of the color constraint. If the uncertainty on the color constraint is raised from 0.1 to 0.2, the above results barely change. However, if it is removed, then neither t_0 nor u_0 is meaningfully constrained.

These results confirm the conjecture of Yee et al. (2015b) on the utility of obtaining post-peak light curves from Spitzer. In particular, they imply that planet-sensitive highmagnification events should be “subjectively selected” even when it is clear that Spitzer observations cannot begin until several days after peak.

3.2. OGLE-2015-BLG-0029: Bright Source in a Crowded Field

OGLE-2015-BLG-0029 was discovered by OGLE on 12 February 2015. On 10 May it was “subjectively selected” for Spitzer observations with “objective” 1/day cadence. This was long before Spitzer observations began, which is critical for establishing the planet sensitivity of events that do not meet objective criteria. According to the protocols of

– 12 –

Yee et al. (2015b), planets and planet sensitivity for subjectively selected events begin with the time of selection, not the start of Spitzer observations. As it turned out, on 1 June, the event met the objective criteria for rising events as laid out in Yee et al. (2015b). Since the cadence for Spitzer observations of objectively selected events was the same as that specified on 10 May, Spitzer observations of OGLE-2015-BLG-0029 were scheduled objectively. These observations began on 11 June, when the event first became visible by Spitzer, and continued until the end of the campaign on 19 July. As specified in Yee et al. (2015b), a cadence of “1/day” determines the relative frequency with which an event should be observed, and the actual cadence is set by this and the available time. Hence, this event received extra observations at the beginning and end of the campaigns, as competing events were eliminated due to Spitzer’s Sun-exclusion angle. Altogether, it was observed at 52 epochs.

In contrast to OGLE-2015-BLG-1395, OGLE-2015-BLG-0029 is a very bright event with I ∼ 14.5–15. However, similar to OGLE-2015-BLG-1395, the MOPEX pipeline basically fails to measure the light curve for this event, albeit not catastrophically, as was the case for OGLE-2015-BLG-1395. See Figure 5. The reason that MOPEX fails is crowding, in particular the presence of an I = 17 neighbor at 0.97^{′′}. This neighbor, which is ∼ 5 times fainter than the microlensed source at 3.6μm at its faintest (first) Spitzer epoch, is clearly resolved in OGLE data but unresolved in individual IRAC images. What makes this case especially instructive is that the source lies almost exactly at the first Airy null (1.06^{′′}), so that it is resolvable in principle, but within one IRAC pixel (1.2^{′′}). If MOPEX is “informed” about the presence of this source, then it assigns the source wildly varying positions and fluxes, which impacts the microlensing light curve catastrophically. If MOPEX is not ”informed” (and so treats the microlensed source and the nearby blend as having a common position), it does better but still has more than an order of magnitude greater scatter than our new algorithm, particularly in its Method 2 variant.

4. Description of Catalog

In Table 1 we list the 170 events monitored in 2015. For each, we report the event name, the coordinates, the first and last day of observation, and the number of observed epochs. The events were chosen based on the microlensing alerts provided by the OGLE (Udalski et al. 2015b) and MOA (Bond et al. 2004) collaborations. The current analysis is based on the preliminary reduced data made available by the Spitzer Science Center almost in real time (on average, 2–3 days after the observations). The final reduction of the data is now publicly available at the NASA/IPAC Infrared Science Database (IRSA, http://irsa.ipac.caltech.edu/frontpage/). Besides the full table, in the online material we provide the light curves for the full sample of observed events, similar to Figures 1 and 5 (excluding of the MOPEX reductions). Finally, an updated version of our photometry

– 13 –

solutions is kept at a publicly available website^6. In particular we provide tables with the data for all three reductions discussed in the text. The flux is expressed in arbitrary units. In some cases, none of the reductions look satisfactory, which may just reflect that the absolute level of source flux variations is very low. The reported error is the purely statistical error from the fitting procedure based on the IRAC uncertainty images (and so underestimates the true uncertainties). In particular, we attribute any additional scatter to systematics due to unmodeled physics (a completely generic feature for all photometry algorithms in crowded fields). These must be considered case per case during the modeling of the events. We note that a single parameter (the “background”) must account for the combined effects of unresolved stars and incompletely modeled wings of distant bright stars, in addition to the true background. It is therefore expected that faint stars will sometimes take on negative flux values. This has no impact on microlensing analyses, which fit only the flux variations and similarly absorb the constant-flux term into a nuisance parameter “f_b”.

We emphasize that for events of special scientific interest, further work on reductions may improve the light curve. In particular, for events in which the external knowledge of the source position is important, such as OGLE-2015-BLG-1395, this can often be improved by measuring this position from OGLE difference images. An additional key aspect of the analysis that may be improved on a case by case basis is the choice of blend stars to be fitted simultaneously with the microlensed source. An additional aspect which may become critical, which is not taken into account in the standard pipeline and that requires further specific analyses, is saturation and nonlinearities in the response of the detector when approaching the pixel full well. An example is that of the Spitzer light curve for the microlensing event OGLE-2015-BLG-0763, which is presented in the online catalog without the special treatment required to deal with saturation. Because this event is of special interest, it was reanalyzed making use of specific procedures to deal with saturation and non-linearity (Zhu et al. 2015b).

5. Discussion

The principal characteristics of the data set that drove the design of the algorithms described here will also be present in the Kepler K2 (Howell et al. 2014) microlensing data. These include,

1) Undersampled PSF,

2) Non-uniform pixel response,

6http://www.astronomy.ohio-state.edu/Spitzer2015/

– 14 –

3) Many stars overlapping the microlensed source,

4) Most (or all) of the other stars non-variable,

5) External astrometric catalog at higher resolution,

6) Dithered exposures,

7) Many epochs.

Hence, it may be profitable to employ similar algorithms on the K2 data set. While the first microlensing data will not be available at least until June 2016, there are already K2 test data from other crowded fields on which these algorithms could be developed.

All of the above characteristics, with the exception of (5) and the partial exception of (3) apply to WFIRST (Spergel et al. 2013a,b) as well. In some respects, the challenges of WFIRST may seem less pressing. However, if having available a source catalog at higher resolution proves important for WFIRST (as it so far appears to be for Spitzer), then now is the time to remedy its absence, before the demise of the Hubble Space Telescope.

We thank J. Ingalls for a useful discussion about PRF fitting with IRAC data. Work by SCN, AG, SC, JCY, and WZ was supported by JPL grant 1500811. Work by YS was supported by an appointment to the NASA Postdoctoral Program at the Jet Propulsion Laboratory, administered by Oak Ridge Associated Universities through a contract with NASA. Work by JCY was performed under contract with the California Institute of Technology (Caltech)/Jet Propulsion Laboratory (JPL) funded by NASA through the Sagan Fellowship Program executed by the NASA Exoplanet Science Institute. This work is based (in part) on observations made with the Spitzer Space Telescope, which is operated by the Jet Propulsion Laboratory, California Institute of Technology under a contract with NASA. Support for this work was provided by NASA through an award issued by JPL/Caltech.

The OGLE project has received funding from the National Science Centre, Poland, grant MAESTRO 2014/14/A/ST9/00121 to AU

REFERENCES

Alard, C. & Lupton, R.H., 1998, ApJ, 503, 325

Anderson, J. & King, I.R. 2000, PASP, 112, 1360

– 15 –

Bond, I.A. Udalski, A., Jorszyński, M., et al. 2004, ApJ, 606, 155 Calchi Novati, S., Gould, A., Udalski, A., et al., 2015, ApJ, 804, 20 Charbonneau, D., Allen, L.E., Megeath, S.T., et al. 2005, ApJ, 626, 523 Cole, A., et al. 2015, in prep Deming, D., Seager, S., Richardson, L.J., & Harrington, J. 2005, Nature, 434, 740 Dong, S., Udalski, A., Gould, A., et al. 2007, ApJ, 664, 862 Fazio, G.G., Ashby, M.L.N., Barmby, P., et al. 2004, ApJS, 154, 39 Gaudi, B.S. & Gould, A. 1997, ApJ, 477, 152 Gould, A. 1995, ApJ, 441, L21 Gould, A. 1999, ApJ, 514, 869 Gould, A., Dong, S., Gaudi, B.S. et al. 2010, ApJ, 720, 1073 Gould, A. & Horne, K. 2013, ApJ, 779, 28 Griest, K. & Safizadeh, N. 1998, ApJ, 500, 37 Howell, S.B., Sobeck, C., Haas, M., et al. 2014, PASP, 126, 398 Ingalls, J., Krick, J., Carey, S., et al. 2012, SPIE Proceedings, 8442, 1Y James, F. & Roos, M. 1975, Comput. Phys. Comm., 10, 343 Lauer, T.R. 1999 PASP, 111, 1434 Makovoz, D. & Marleau, F.R. 2005, PASP, 117, 1113 Refsdal, S. 1966, MNRAS, 134, 315 Schechter, P.L., Mateo, M., & Saha, A. 1993, PASP, 105, 1342 Shvartzvald, Y., Udalski, A., Gould, A. et al. 2015, ApJ, submitted, arXiv:1508.06636 Spergel, D., Gehrels, N., Breckinridge, J., et al. 2013a, arXiv:1305.5422 Spergel, D., Gehrels, N., Breckinridge, J., et al. 2013b, arXiv:1305.5425 Storrie-Lombardi, L. J. and Dodd, S. R. 2010, SPIE Proceedings, 7737, 0L

– 16 –

Street, R., Udalski, A., Calchi Novati, S. et al. 2015, ApJ, submitted, arXiv:1508.07027 Udalski, A. 2003, Acta Astron., 53, 291 Udalski, A.,Szymanski, M., Kaluzny, J., Kubiak, M., Mateo, M., Krzeminski, W., & Paczyński, B. 1994, Acta Astron., 44, 317 Udalski, A., Yee, J.C., Gould, A., et al. 2015a, ApJ, 799, 237 Udalski, A., Szymański, M.K. & Szymański, G. 2015b, Acta Astronom., 65, 1 Yee, J.C., Udalski, A., Calchi Novati, S.,et al. 2015a, ApJ, 802, 76 Yee, J.C., Gould, A., Beichman, C., et al. 2015b, ApJ, in press, arXiv:1505.00014 Zhu, W., Udalski, A., Gould, A., et al. 2015a, ApJ, 805, 8 Zhu, W., Calchi Novati, S., A., Gould, A., et al. 2015b, arXiv:1510.02097

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 17 –

Fig. 1.— Spitzer photometry of OGLE-2015-BLG-1395 using four different packages: MOPEX, and the three variants of the algorithm presented in this paper; Method 1: externally fixed centroid, Method 2: centroid jointly fitted to entire light curve, Method 3: centroid fitted separately for each epoch. Both MOPEX and Method 3 fail completely and for the same reason: very faint target.

– 18 –

Fig. 2.— Model-independent regression of H-band on I-band instrumental fluxes from CTIO-SMARTS observations of OGLE-2015-BLG-1395. These yield a model-independent instrumental source color (I − H)_{s,ctio} = −2.5 log(F_I /F_H ) ≈ −2.5 log(4.00/2.25) = −0.624 ± 0.007. The circles indicate the points used for the color determination whereas recursively excluded points are indicated by crosses.

– 19 –

Fig. 3.— Color-color diagram I_{ctio} − L_{spitzer} vs. (I − H)_{ctio} based on field stars near OGLE- 2015-BLG-1395. Only stars −0.5 < (I − H)_{ctio} < 0.2 are included in the fit to ensure that it is dominated by bulge stars that are reasonably warm T > 4250. The open points have been recursively excluded. The blue line is the source color measured in Figure 2. From this we derive an instrumental color (I_{ctio} − L_{spitzer})_s = −3.95 ± 0.10 .

– 20 –

Fig. 4.— Joint point-lens parallax fit of OGLE and Spitzer observations of OGLE-2015- BLG-1395, using Method 2 reductions for Spitzer. The OGLE data (black) are shown at their observed calibrated I-band magnitude. The Spitzer data (red) are scaled so that their “I magnitude” corresponds to the same magnification as an OGLE point at this same magnitude. The fit is constrained by the (I_{ogle} −L_{spitzer})_s = −4.68±0.10 source color, which is taken from Figure 3 (after accounting for the instrumental color relation I_{ctio} − I_{ogle} = 0.68).

– 21 –

Fig. 5.— Four reductions of OGLE-2015-BLG-0029 Spitzer data. From top to bottom they are Methods 1, 2, 3, and the standard MOPEX pipeline. Although the microlensed source is bright, it is blended with a ∼ 5 times fainter star at 1^{′′}, which is similar to the first Airy null (1.06^{′′}) but smaller than an IRAC pixel (1.2^{′′}). Method 2 copes with this situation best. MOPEX becomes completely confused if it is “informed” of the existence of this blend (not shown) and does better if it treats the blend as coincident with the microlensed source (displayed), but the results are still quite poor when compared to Method 2.

– 22 –

Table 1. Observed Events

Event RA (J2000) DEC (J2000) Spitzer

first last epochs (degrees) (degrees) (HJD) (HJD)

MOA-BLG-2015-020 268.219917 -32.485861 7183.95 7221.76 61 MOA-BLG-2015-079 268.085334 -31.295665 7183.66 7221.76 112 MOA-BLG-2015-117 268.792652 -35.080247 7184.10 7212.60 45 MOA-BLG-2015-220 271.832485 -25.467555 7187.12 7222.96 48 MOA-BLG-2015-237 269.467804 -31.472354 7184.97 7223.06 54 MOA-BLG-2015-240 270.585946 -31.996441 7185.80 7212.75 37 MOA-BLG-2015-245 269.321669 -27.857411 7184.99 7222.60 78 MOA-BLG-2015-267 269.214339 -30.775359 7199.49 7222.65 39 MOA-BLG-2015-282 272.572708 -29.265556 7199.71 7222.94 29 MOA-BLG-2015-287 270.125760 -33.017623 7199.35 7222.89 36 OGLE-BLG-2014-0298 268.565625 -31.018083 7185.73 7221.84 25 OGLE-BLG-2014-0613 268.490300 -28.572670 7183.98 7221.81 158 OGLE-BLG-2015-0011 269.217833 -29.283250 7184.96 7222.59 53 OGLE-BLG-2015-0022 268.090792 -29.785028 7183.67 7221.05 60 OGLE-BLG-2015-0029 269.944167 -28.644944 7185.31 7222.89 52 OGLE-BLG-2015-0034 270.580333 -27.516083 7186.01 7222.92 62 OGLE-BLG-2015-0060 269.993125 -27.780944 7185.78 7222.90 50 OGLE-BLG-2015-0081 268.653000 -28.996278 7184.10 7221.82 57 OGLE-BLG-2015-0145 270.177833 -35.154056 7185.29 7222.88 51 OGLE-BLG-2015-0149 270.288208 -32.557694 7185.80 7222.93 49 OGLE-BLG-2015-0195 266.790792 -33.417278 7182.39 7220.58 70 OGLE-BLG-2015-0196 266.492958 -32.956778 7182.39 7220.56 70 OGLE-BLG-2015-0211 262.359083 -30.981750 7180.20 7216.80 109 OGLE-BLG-2015-0238 265.708250 -36.818500 7182.37 7219.17 75 OGLE-BLG-2015-0244 268.240625 -28.980889 7183.97 7221.75 59 OGLE-BLG-2015-0254 271.553292 -26.850194 7186.87 7222.96 49 OGLE-BLG-2015-0326 274.074625 -26.338139 7199.73 7223.03 29 OGLE-BLG-2015-0350 268.248583 -31.820278 7183.95 7221.76 61 OGLE-BLG-2015-0379 269.104292 -29.574056 7184.61 7222.58 54 OGLE-BLG-2015-0388 268.468917 -28.534028 7183.98 7221.81 66 OGLE-BLG-2015-0401 264.081167 -27.774139 7180.19 7213.03 94 OGLE-BLG-2015-0444 262.917375 -30.673111 7180.20 7216.79 84 OGLE-BLG-2015-0448 272.559917 -31.752611 7187.54 7223.04 211 OGLE-BLG-2015-0461 270.043208 -28.156944 7185.79 7222.90 58 OGLE-BLG-2015-0477 273.200500 -25.014028 7188.88 7222.97 45 OGLE-BLG-2015-0479 265.918958 -35.509278 7182.38 7219.17 67 OGLE-BLG-2015-0529 270.264667 -29.922917 7185.79 7222.92 51 OGLE-BLG-2015-0561 267.224542 -29.674444 7183.09 7220.61 68 OGLE-BLG-2015-0565 269.153708 -29.128056 7184.62 7222.59 53 OGLE-BLG-2015-0572 272.847750 -25.473861 7188.88 7222.97 44 OGLE-BLG-2015-0607 274.049625 -27.451306 7189.13 7223.03 54 OGLE-BLG-2015-0642 263.539458 -24.882528 7192.99 7216.78 25 OGLE-BLG-2015-0692 268.079708 -28.133917 7185.70 7221.07 73

– 23 –

Table 1—Continued

Event RA (J2000) DEC (J2000) Spitzer

first last epochs (degrees) (degrees) (HJD) (HJD)

OGLE-BLG-2015-0703 269.048583 -29.853389 7184.47 7222.17 65 OGLE-BLG-2015-0709 266.113292 -34.442972 7182.38 7219.16 74 OGLE-BLG-2015-0713 272.660042 -28.412083 7213.65 7223.01 28 OGLE-BLG-2015-0749 264.955708 -27.511722 7180.78 7206.48 59 OGLE-BLG-2015-0761 272.084667 -25.443056 7187.52 7222.97 46 OGLE-BLG-2015-0763 263.097542 -29.302694 7180.19 7216.78 142 OGLE-BLG-2015-0769 265.670083 -27.368833 7182.40 7219.15 59 OGLE-BLG-2015-0772 269.421583 -28.143139 7184.99 7222.60 54 OGLE-BLG-2015-0798 271.680583 -27.590167 7186.86 7222.95 47 OGLE-BLG-2015-0802 266.514625 -36.497917 7182.38 7220.57 76 OGLE-BLG-2015-0808 267.184833 -33.102278 7199.31 7220.59 25 OGLE-BLG-2015-0828 267.132917 -34.184778 7183.08 7220.58 72 OGLE-BLG-2015-0843 271.197042 -27.176472 7186.87 7222.95 61 OGLE-BLG-2015-0845 271.088708 -31.580556 7186.24 7222.93 148 OGLE-BLG-2015-0877 273.676958 -27.970917 7188.92 7212.92 29 OGLE-BLG-2015-0912 265.957583 -26.519944 7182.41 7219.15 57 OGLE-BLG-2015-0914 269.311750 -29.760139 7184.96 7222.58 53 OGLE-BLG-2015-0925 270.259292 -26.384889 7199.67 7222.91 29 OGLE-BLG-2015-0926 270.883792 -26.135806 7199.67 7222.91 29 OGLE-BLG-2015-0930 264.393917 -25.512667 7180.21 7218.07 111 OGLE-BLG-2015-0941 272.348083 -25.762056 7187.53 7222.98 47 OGLE-BLG-2015-0944 265.258000 -27.853806 7181.09 7198.12 42 OGLE-BLG-2015-0955 273.709833 -27.006833 7213.88 7223.01 14 OGLE-BLG-2015-0958 267.754958 -28.416861 7183.32 7221.06 64 OGLE-BLG-2015-0961 268.146375 -30.080361 7185.69 7221.75 131 OGLE-BLG-2015-0965 269.291083 -28.961056 7184.99 7222.59 52 OGLE-BLG-2015-0966 268.754250 -29.047111 7192.64 7222.14 119 OGLE-BLG-2015-0968 268.985833 -28.854083 7184.47 7222.19 56 OGLE-BLG-2015-0977 272.061375 -26.159472 7187.53 7222.96 47 OGLE-BLG-2015-0984 263.875167 -26.553778 7185.84 7217.51 39 OGLE-BLG-2015-0987 268.193708 -28.361222 7183.97 7221.07 65 OGLE-BLG-2015-1020 263.050417 -29.781722 7180.19 7216.78 108 OGLE-BLG-2015-1076 270.744792 -32.853694 7192.81 7222.94 135 OGLE-BLG-2015-1077 274.478083 -22.992611 7192.93 7223.03 64 OGLE-BLG-2015-1084 271.146417 -26.168028 7186.87 7212.80 35 OGLE-BLG-2015-1095 267.693875 -32.708167 7183.24 7221.04 65 OGLE-BLG-2015-1096 267.872333 -32.153694 7183.40 7221.04 62 OGLE-BLG-2015-1100 263.669042 -29.885194 7180.20 7217.52 84 OGLE-BLG-2015-1109 270.213083 -30.645139 7185.80 7191.80 13 OGLE-BLG-2015-1112 273.535250 -25.482778 7188.79 7222.98 51 OGLE-BLG-2015-1113 264.277208 -27.299083 7180.18 7218.10 88 OGLE-BLG-2015-1123 273.648042 -26.507389 7188.88 7223.01 70 OGLE-BLG-2015-1124 273.253750 -27.532861 7188.89 7206.39 23

– 24 –

Table 1—Continued

Event RA (J2000) DEC (J2000) Spitzer

first last epochs (degrees) (degrees) (HJD) (HJD)

OGLE-BLG-2015-1129 266.413125 -27.160028 7182.41 7185.33 18 OGLE-BLG-2015-1136 268.557583 -28.708361 7185.71 7198.40 24 OGLE-BLG-2015-1145 269.451042 -29.080444 7185.63 7222.84 79 OGLE-BLG-2015-1148 270.259625 -28.686111 7185.79 7198.57 22 OGLE-BLG-2015-1150 273.049208 -25.661694 7199.72 7223.05 121 OGLE-BLG-2015-1153 264.317792 -29.426389 7193.01 7218.08 50 OGLE-BLG-2015-1161 267.618375 -29.979222 7192.59 7220.61 34 OGLE-BLG-2015-1167 269.024500 -28.626361 7184.46 7222.20 56 OGLE-BLG-2015-1172 268.545417 -31.103194 7185.73 7198.41 24 OGLE-BLG-2015-1184 268.514458 -30.311250 7183.96 7185.41 10 OGLE-BLG-2015-1187 268.657792 -31.681222 7199.45 7222.16 27 OGLE-BLG-2015-1188 268.877125 -31.281667 7184.34 7222.17 56 OGLE-BLG-2015-1189 270.735000 -30.373056 7192.80 7222.93 87 OGLE-BLG-2015-1194 261.049625 -28.947472 7207.44 7215.02 9 OGLE-BLG-2015-1196 266.466667 -24.287278 7182.41 7198.06 37 OGLE-BLG-2015-1197 264.229917 -29.782028 7207.42 7218.09 31 OGLE-BLG-2015-1204 268.927083 -29.384306 7199.50 7222.18 27 OGLE-BLG-2015-1207 267.709667 -23.445500 7192.93 7220.56 31 OGLE-BLG-2015-1212 268.103292 -29.181111 7185.70 7206.09 92 OGLE-BLG-2015-1221 268.418792 -32.279306 7199.33 7221.94 101 OGLE-BLG-2015-1223 265.690333 -27.528333 7182.40 7212.95 53 OGLE-BLG-2015-1227 268.327417 -29.652833 7199.41 7221.83 26 OGLE-BLG-2015-1232 267.641125 -32.739639 7185.66 7191.98 16 OGLE-BLG-2015-1234 267.179917 -24.520028 7192.93 7220.56 31 OGLE-BLG-2015-1236 265.421375 -27.809278 7185.81 7219.15 42 OGLE-BLG-2015-1241^a 269.529708 -27.932000 7185.63 7198.49 35 OGLE-BLG-2015-1256 269.537083 -28.769083 7185.77 7206.27 31 OGLE-BLG-2015-1262 267.523792 -30.712611 7185.68 7206.04 33 OGLE-BLG-2015-1263 267.717208 -32.380389 7185.67 7206.03 32 OGLE-BLG-2015-1264 264.976250 -34.584722 7192.51 7219.17 31 OGLE-BLG-2015-1268 269.207375 -21.899333 7192.61 7212.93 48 OGLE-BLG-2015-1281 273.034625 -27.167694 7192.86 7222.95 36 OGLE-BLG-2015-1285 264.846875 -27.820278 7199.81 7218.09 39 OGLE-BLG-2015-1288 267.516625 -33.368472 7192.52 7221.03 35 OGLE-BLG-2015-1289 269.461583 -28.217306 7206.94 7222.83 22 OGLE-BLG-2015-1295 270.226042 -27.302139 7199.39 7223.08 127 OGLE-BLG-2015-1297 268.087542 -29.683806 7192.59 7206.05 17 OGLE-BLG-2015-1303 273.970333 -30.373194 7199.42 7223.02 68 OGLE-BLG-2015-1309 264.693250 -27.479472 7199.82 7218.10 20 OGLE-BLG-2015-1315 266.672583 -33.458194 7206.71 7220.57 17 OGLE-BLG-2015-1319 269.443333 -32.472194 7206.95 7223.07 22 OGLE-BLG-2015-1325 266.423625 -35.957278 7213.41 7220.83 18 OGLE-BLG-2015-1328 267.063208 -32.687778 7199.32 7206.02 8

– 25 –

Table 1—Continued

Event RA (J2000) DEC (J2000) Spitzer

first last epochs (degrees) (degrees) (HJD) (HJD)

OGLE-BLG-2015-1339 263.321917 -30.271222 7199.91 7217.52 18 OGLE-BLG-2015-1341 268.563667 -28.350167 7199.47 7221.81 25 OGLE-BLG-2015-1344 268.934542 -27.940028 7192.67 7222.32 57 OGLE-BLG-2015-1346 269.806958 -28.936611 7192.79 7222.88 37 OGLE-BLG-2015-1348 269.487708 -30.509417 7199.55 7223.06 29 OGLE-BLG-2015-1350 266.685583 -36.592889 7199.29 7220.57 73 OGLE-BLG-2015-1352 265.141875 -27.338306 7207.37 7218.08 13 OGLE-BLG-2015-1366 268.289250 -21.944056 7213.90 7221.74 10 OGLE-BLG-2015-1368 267.945083 -29.575167 7199.34 7221.06 77 OGLE-BLG-2015-1370 268.956667 -29.124111 7206.90 7222.18 19 OGLE-BLG-2015-1371 268.665875 -29.093944 7206.87 7221.83 18 OGLE-BLG-2015-1374 271.134375 -26.887806 7213.64 7223.00 28 OGLE-BLG-2015-1378 264.834792 -22.976222 7199.79 7218.06 20 OGLE-BLG-2015-1383 268.651292 -28.702250 7213.53 7221.94 22 OGLE-BLG-2015-1392 264.095125 -27.298917 7213.68 7217.82 11 OGLE-BLG-2015-1395 271.783917 -26.303333 7199.51 7222.96 36 OGLE-BLG-2015-1400 268.109625 -28.866250 7213.47 7221.55 20 OGLE-BLG-2015-1403 267.882875 -29.340361 7206.79 7221.06 17 OGLE-BLG-2015-1412 270.124875 -27.435361 7207.00 7223.05 35 OGLE-BLG-2015-1416 270.937500 -26.848056 7207.07 7222.92 21 OGLE-BLG-2015-1420 271.477500 -28.557361 7213.65 7223.02 28 OGLE-BLG-2015-1424 264.063292 -29.642833 7199.83 7218.09 20 OGLE-BLG-2015-1425 263.142958 -30.716333 7213.69 7217.10 9 OGLE-BLG-2015-1435 269.842167 -27.219222 7199.57 7206.27 8 OGLE-BLG-2015-1440 270.973167 -27.707417 7213.64 7222.99 28 OGLE-BLG-2015-1447 269.233417 -31.941111 7213.50 7222.81 27 OGLE-BLG-2015-1448 270.939333 -27.852194 7207.04 7222.99 35 OGLE-BLG-2015-1450 270.210000 -28.671028 7213.51 7223.07 56 OGLE-BLG-2015-1457 267.857167 -30.436389 7206.78 7221.05 17 OGLE-BLG-2015-1467 265.107500 -23.801389 7207.38 7212.97 7 OGLE-BLG-2015-1469 265.266583 -24.848944 7213.67 7218.92 13 OGLE-BLG-2015-1470 268.501833 -31.592806 7206.82 7221.84 18 OGLE-BLG-2015-1481 268.008083 -30.985028 7213.48 7221.54 20 OGLE-BLG-2015-1482 267.630542 -30.888694 7206.73 7221.04 17 OGLE-BLG-2015-1485 265.380250 -24.214972 7207.35 7218.92 20 OGLE-BLG-2015-1492 268.686000 -29.707361 7213.48 7221.96 22 OGLE-BLG-2015-1500 272.021583 -27.445611 7207.12 7212.84 7 OGLE-BLG-2015-1521 267.485792 -21.411889 7213.66 7220.82 17 OGLE-BLG-2015-1530 269.018958 -28.240472 7213.53 7222.38 24 OGLE-BLG-2015-1533 269.048083 -29.476417 7213.51 7222.39 24 OGLE-BLG-2015-1553 265.857042 -23.377750 7213.67 7219.14 14

Note. — We report name, target coordinates and information about Spitzer observations for the 170 microlensing events monitored during the 2015 Spitzer microlens-

– 26 –

ing campaign. We note that 2 out of the 10 MOA events have also been observed by the OGLE collaboration (specifically MOA-BLG-2015-020 and MOA-BLG- 2015-245 are also known as OGLE-BLG-2015-0102 and OGLE-BLG-2015-1286, respectively) and 64 out of the 160 OGLE events have also been observed by the MOA collaboration (for the detail of this we refer to the MOA microlensing alert webpage http://www.phys.canterbury.ac.nz/moa/microlensing alerts.html). In Fig. 6 we show the corresponding lightcurves for the 3 variants of our photometry reduction for all the events (online material). The first method, which relies on an analysis based on the OGLE online catalog of nearby stars to the microlensed source, is not presented for MOA-only events and for 4 OGLE events (OGLE-BLG-2015-0561, OGLE-BLG-2015-0941, OGLE- BLG-2015-1112 and OGLE-BLG-2015-1234).

aThis event is also known as OGLE-BLG-2015-1253.