arXiv:1408.6095v2 [astro-ph.HE] 23 Sep 2014

Draft version October 27, 2020 Preprint typeset using L^ATEX style emulateapj v. 04/17/13

SUZAKU OBSERVATION OF IRAS 00521−7054, A PECULIAR TYPE-II AGN WITH A VERY BROAD FEATURE AT 6 KEV

C. Ricci^{1,*}, F. Tazaki^{1,2}, Y. Ueda^1, S. Paltani^3, R. Boissay^3, Y. Terashima^4 Draft version October 27, 2020

ABSTRACT IRAS 00521−7054 is the first Seyfert 2 in which the presence of an extremely large Fe Kα line has been claimed. We report here on the analysis of a 100 ks Suzaku observation of the source. We confirm the existence of a very strong excess over the power-law X-ray continuum at E ∼ 6 keV (EW ≃ 800 eV), extending down to ∼ 4.5 keV, and found that the X-ray spectrum of the source can be explained by two different models. i) An absorption scenario, in which the X-ray source is obscured by two fully-covering ionized absorbers, with a strong reflection component from neutral material (R ∼ 1.7), a black body component and four narrow Gaussian lines (corresponding to Fe Kα, Fe Kβ, Fe xxv and Fe xxvi). ii) A reflection scenario, in which the X-ray spectrum is dominated by an obscured (log N_H ∼ 22.9) blurred reflection produced in an ionized disk around a rotating supermassive black hole with a spin of a ≥ 0.73, and affected by light-bending (R ∼ 2.7), plus two narrow Gaussian lines (corresponding to Fe Kα and Fe Kβ). The narrow Fe Kα and Kβ lines are consistent with being produced by ionized iron, and in particular by Fe xiv–Fe xvi and Fe xii–Fe xvi for the absorption and reflection scenario, respectively. While the X-ray continuum varies significantly during the observation, the intensity of the broad feature appears to be constant, in agreement with both the absorption and reflection scenarios. For both scenarios we obtained a steep power-law emission (Γ ∼ 2.2 − 2.3), and we speculate that the source might be an obscured narrow-line Seyfert 1.

1. INTRODUCTION

Iron emission lines are one of the most prominent features in the X-ray spectra of Active Galactic Nuclei (AGN), and are the most important tracers of the material surrounding the accreting supermassive black hole (SMBH). Most AGN show evidence of a narrow Fe Kα line at 6.4 keV, likely produced by reflection from neutral material (i.e. less ionized than Fe xviii, e.g., Makishima 1986; Yaqoob et al. 2001) in the broad line region (BLR, e.g., Bianchi et al. 2008) or in the molecular torus (e.g., Shu et al. 2010b; Ricci et al. 2014a). The idea that the primary X-ray continuum reprocessed in the innermost part of the accretion disk might give rise to iron lines broadened by Doppler motion and relativistic effects was first proposed by Fabian et al. (1989). Few years later, using ASCA, Mushotzky et al. (1995) and Tanaka et al. (1995) found the first evidence of the existence of such broad Fe Kα lines in the X-ray spectra of NGC 5548, IC 4329A and MCG−6−30−15. With the advent of XMM-Newton and Suzaku, broad lines have been detected in about 30 − 50% of local bright unabsorbed AGN (e.g., de La Calle Pérez et al. 2010, Patrick et al. 2012). The ratio between the flux of the broad and the narrow component of the Fe Kα line in the 6.35–6.45 keV region is expected to be ≤ 25%, except in the case of truncated disks, as the disk emission is less blurred and more flux is emitted around the core of the line, or in the

1 Department of Astronomy, Kyoto University, Oiwake-cho, Sakyo-ku, Kyoto 606-8502, Japan.

2 Mizusawa VLBI Observatory, National Astronomical Observatory of Japan, Mitaka, Tokyo 181-8588, Japan.

3 Department of Astronomy, University of Geneva, ch. d’Ecogia 16, 1290 Versoix, Switzerland.

4 Department of Physics, Ehime University, Matsuyama, 790- 8577, Japan.

* ricci@kusastro.kyoto-u.ac.jp

presence of light-bending (Ricci et al. 2014b). A possible alternative explanation to the existence of relativistic broad iron lines is that broad features are artificially created by the distortion of the X-ray continuum created by ionized absorbers (Turner & Miller 2009 and references therein, Miyakawa et al. 2012).

While they are rather common in type 1-1.5 AGN, broad Fe Kα lines have so far been found in only a few obscured objects: the Seyfert 2s IRAS 18325−5926 (Iwasawa et al. 1996; Lobban & Vaughan 2014) and MCG−5−23−16 (Dewangan et al. 2003), the Seyfert 1.9 NGC 2992 (Shu et al. 2010a), and the Seyfert 1.8s IRAS 13197−1627 (Miniutti et al. 2007) and NGC 1365 (Risaliti et al. 2013). Another absorbed AGN showing evidence of a broad Fe Kα line is the obscured narrowline Seyfert 1 (NLS1) galaxy NGC 5506 (Guainazzi et al. 2010). Recently Tan et al. (2012), analysing two ∼ 10 ks XMM-Newton observations of the Seyfert 2 IRAS 00521−7054 (z=0.0689), claimed to have detected a very strong and broad (with an equivalent width EW = 1.3±0.3 keV) Fe Kα line. Tan et al. (2012) found that, to reproduce this large feature, a maximally rotating (with a spin of a = 0.97^{+0.03}_{−0.13}) SMBH is needed. However, due to the low signal to noise ratio of the XMM-Newton observations, they could not clearly distinguish between the scenario in which the line is relativistically broadened, and that in which the X-ray source is obscured by partially covering neutral absorbers. We report here the study of a 100 ks Suzaku follow-up observation of IRAS 00521−7054, aimed at understanding the characteristics and the nature of its broad feature at 6 keV.

2 Ricci et al.

2. DATA REDUCTION

2.1. Suzaku

The Suzaku observatory (Mitsuda et al. 2007) carries on board a set of X-ray CCD cameras, the X-ray Imaging Spectrometer (XIS, Koyama et al. 2007), and the nonimaging Hard X-ray Detector (HXD, Takahashi et al. 2007), composed of Si positive intrinsic negative (PIN) photodiodes and Gadolinium Silicon Oxide (GSO) scintillation counters. XIS is composed of three operational cameras, the front-illuminated (FI) XIS 0 and XIS 3, and the back-illuminated (BI) XIS 1 (hereafter BI-XIS).

IRAS 00521−7054 was observed by Suzaku on 2013, May 31st (observation ID 708005010) at the “XIS nominal” pointing position. Each XIS camera had net exposure of 103 ks, while the exposure of HXD/PIN was 87.3 ks. The light curves and spectra were extracted using HEAsoft version 6.12 and Suzaku CALDB version 20130916.

For each of the three XIS cameras we extracted light curves and spectra from XIS cleaned events, processed by the Suzaku team, using a circular region with a radius of 1.7 arcmin centred on the source. The background was taken from a source-free annulus region centred at the source peak, with an internal and external radius of 3.5 and 5.7 arcmin, respectively. We excluded from the background a circular region of 55 arcsec around a possible very faint X-ray source. We generated the ancillary response matrices (ARFs) and the detector response matrices (RMFs) using the xisrmfgen and xissimarfgen tasks (Ishisaki et al. 2007), respectively. The spectra and light-curve obtained by XIS 0 and XIS 3, were merged (hereafter FI-XIS) using mathpha, addrmf and addarf.

The flux of IRAS 00521−7054 is below the detection threshold of HXD/GSO, therefore we only analyzed HXD/PIN data. The HXD/PIN spectrum was extracted from the cleaned event files, and then corrected for dead time using hxddtcor. We adopted the response file corresponding to the 11th epoch of Suzaku observations and to the observation mode (ae hxd pinxinome11 20110601.rsp). We produced the background spectra using the latest release of the tuned non-X-ray background (NXB) event files provided by the HXD team, which takes into account the 3– 4% underestimation of the NXB flux for observations carried out after July 31st 2012^6. We added to the background spectrum that of the cosmic X-ray background (CXB) by using the formula of Gruber et al. (1999). We found that the PIN spectrum is consistent with the systematic error of the NXB (3% of the NXB level, Fukazawa et al. 2009), and therefore we did not use the data for the spectral analysis. The 16–60 keV PIN count-rate of the source before NXB subtraction is 0.211 ± 0.002 ct s^{−1}, which, assuming a power-law emission, corresponds to a flux of 1.37 × 10^{−10} erg cm^{−2} s^{−1}. Consequently, taking into account the 3% systematic uncertainty of the NXB, we can place an upper limit of F_{15−60 keV} ≲ 4.1 × 10^{−12} erg cm^{−2} s^{−1} on the 15–60 keV flux of IRAS 00521−7054.

6 http://www.astro.isas.jaxa.jp/suzaku/analysis/hxd/pinnxb/tuned/

Figure 1. FI-XIS background subtracted 2–10 keV light curve of IRAS 00521−7054 in 5760 s orbital bins. The horizontal dotted line represents the average flux of the observation. The red squares, black diamonds and green circles represent the high, mean and low flux state, respectively (see Sect. 3 and Sect. 5).

2.2. XMM-Newton

We reanalysed the two XMM-Newton observations of IRAS 00521−7054 discussed by Tan et al. (2012), taking into account the data obtained by the PN (Strüder et al. 2001) and MOS (Turner et al. 2001) cameras on board XMM-Newton. The two observations were carried out on March 22nd and April 22nd 2006 (PI F. Nicastro). The original data files (ODFs) were reduced using the XMM- Newton Standard Analysis Software (SAS) version 12.0.1 (Gabriel et al. 2004), and the raw PN and MOS data files were then processed using the epchain and emchain tasks, respectively.

For each observation we checked the background light curve in the 10–12 keV energy band for PN, and above 10 keV for MOS, in order to filter the exposures for periods of high background activity. The threshold was set to 0.5 ct s^{−1} for the three detectors. Only patterns corresponding to single and double events (PATTERN ≤ 4) were selected for PN, and corresponding to single, double, triple and quadruple events for MOS (PATTERN ≤ 12). For the first observation (ID 0301150101) the net exposures were 7.8, 10.2 and 9.6 ks for PN, MOS1 and MOS2, respectively. The source spectra were extracted from the final filtered event list using circular regions centred on the object, with a radius of 17.5, 14 and 14 arcsec for PN, MOS1 and MOS2, respectively. For the second observation (ID 0301151601) the exposures were 10.4 (PN), and 13.3 ks (MOS1 and MOS2), while the radius was 22.5, 14 and 14 arcsec for PN, MOS1 and MOS2, respectively. In both observations and for all cameras the background was estimated from circular regions with a radius of 40 arcsec located on the same CCD of the source, where no other source was present. No pile-up was detected in the two observations for any of the three cameras. The ARFs and RMFs were created using the arfgen and rmfgen tasks, respectively.

3. TIME ANALYSIS

We analyzed the 2–10 keV FI-XIS light-curve (in 5760 s orbital bins) of IRAS 00521−7054 (Fig. 1), and found that the source shows a fractional rms variability of F_{Var} = 16.7 ± 1.1%.

On a longer time-scale, we found no evidence of flux variability in the 2–10 keV energy range between the

Suzaku observation of IRAS 00521−7054 3

Figure 2. Left panel: ratio between Suzaku/XIS data and the fit to the spectrum obtained by applying a simple absorbed power-law model (TBABS_{Gal} ×ZTBABS×ZPOW) to the data in the 2–4.5 keV and 7.5–10 keV range (in the rest frame of the source). The black and red points represent the data obtained by FI-XIS and BI-XIS, respectively. Right panel: zoom in the 3.5–8.5 keV region. The vertical dashed line shows the energy of the neutral Fe Kα line.

Suzaku observations (F_{2−10} = 2.3 × 10^{−12} erg cm^{−2} s^{−1}), and the two XMM-Newton observation (F_{2−10} = 2.4 × 10^{−12} erg cm^{−2} s^{−1}, Tan et al. 2012) carried out six years earlier. The source also showed a consistent flux level between the two XMM-Newton observations carried out one month apart. No significant spectral variability is detected, and for the three observations the ratio between the 5–10 keV and the 2–5 keV flux is constant (F_{5−10 keV}/F_{2−5 keV} ∼ 1.6). The luminosity of the source in the 2–10 keV band is 2.5 × 10^{43} erg s^{−1}.

4. SPECTRAL ANALYSIS

The spectral analysis was carried out using XSPEC v12.7.1b (Arnaud 1996). We initially used only the higher signal-to-noise ratio Suzaku data to find the best models, and then fitted simultaneously the Suzaku and XMM-Newton spectra to better constrain the parameters of the models (Tables 1 and 2).

We used data in the 0.7–10 keV and 0.6–8.0 keV region, for Suzaku FI-XIS and BI-XIS, respectively, and for both FI-XIS and BI-XIS we excluded the interval 1.7–1.9 keV, as indicated by the standard guidelines. We added to the models a multiplicative factor to take into account the cross-calibration between FI-XIS and BI-XIS. We fixed the factor to one for FI-XIS, and let the BI-XIS factor free. For all the spectra the value of the factor turned out to be close to one within a few percent. We added to all the fits Galactic absorption, fixing the column density to N^{Gal}_H = 4.44 × 10^{20} cm^{−2} (Dickey & Lockman 1990). We took into account in all models the redshift of IRAS 00521−7054, and in the following we will always refer to the rest frame energy of the source.

As a first test, we fitted the combined FI-XIS and BI- XIS spectra with a power-law absorbed by neutral material. We modelled the neutral absorption using TBABS (Wilms et al. 2000)^7, and obtained N_H ≃ 6 × 10^{22} cm^{−2} and a chi-squared of χ^2 = 982.5 for 753 degrees of freedom (DOF). In the left panel of Fig. 2 we show the residuals obtained by fitting the 2–4.5 keV and 7.5–10 keV spectrum with the absorbed power-law model. The figure clearly shows the presence of a soft excess below 2 keV and of a large excess in the 4.5-7 keV region (right panel).

More complex modelling is thus needed to reproduce

7 in XSPEC TBABS_{Gal} ×(TBABS×ZPOW)

the X-ray spectrum of IRAS 00521−7054. In the following we describe the results obtained by applying partially covering neutral (Sect. 4.1.1) or ionized (Sect. 4.1.2) absorption models, and then a blurred reflection scenario (Sect. 4.2).

4.1. Absorption models

4.1.1. Partially covering neutral absorber

A scenario in which the X-ray source is partially covered by a neutral absorber was proposed by Tan et al. (2012) as one of the possible explanations of the strong excess observed in the Fe Kα region. Fitting the XIS spectra with a power-law continuum absorbed by a partially covering neutral absorber^8, results in χ^2 = 874.5 for 752 DOF, and cannot account for the strong residuals in the iron line region (panel A of Fig. 3). Adding another fully covering neutral absorber, consistently with what was done by Tan et al. (2012)^9, does not improve the fit (Δχ^2 ≃ 0).

Seyfert 2s usually show evidence of a narrow (σ ≃ 2, 000 km s^{−1}, Shu et al. 2011) Fe Kα line centred at 6.4 keV (e.g., Fukazawa et al. 2011). To take into account this feature, we added to the model a Gaussian line (ZGAUSS^{10}) with a width fixed to 1 eV, well below the energy resolution of XIS, and with energy fixed at 6.4 keV. This improves the fit (Δχ^2 ≃36), but still leaves important residuals above 6.5 keV. Leaving both the energy and width of the line free to vary improves the fit (χ^2/DOF = 785.1/752), but leaves significant residuals at ∼ 6 keV. Moreover the fit requires a very large line (σ = 797^{+189}_{−166} eV, EW = 660^{+130}_{−110} eV) centred at E = 6.18^{+0.15}_{−0.24} keV, with a full-width at half maximum of FWHM ≃ 91, 100 km s^{−1}. The EW of the lines was calculated using the eqwidth command in XSPEC.

A significant fraction of Seyfert 1s (e.g., Patrick et al. 2012), and at least few Seyfert 2s (e.g., Lobban & Vaughan 2014) show evidence of emission from ionized iron, typically Fe xxv and Fe xxvi. Therefore we added three narrow lines (fixing σ = 1eV)^{11},

8 TBABS_{Gal} ×(ZPCFABS×ZPOW) 9 TBABS_{Gal} ×[ZTBABS×(ZPCFABS×ZPOW)] 10 TBABS_{Gal} ×(ZPCFABS×ZPOW + ZGAUSS) 11 TBABS_{Gal} ×(ZPCFABS×ZPOW + 3×ZGAUSS)

4 Ricci et al.

Figure 3. Ratio between the Suzaku data and the models discussed in Sect. 4. The black and red points represent the data obtained by FI-XIS and BI-XIS, respectively. Top panel: ratios obtained using neutral and ionized absorption models. Panels A and B show the residuals obtained applying a partially covering neutral absorber model (Sect. 4.1.1), while panels C and D illustrate the ratios between the data and two models which consider fully covering ionized absorption (Sect. 4.1.2). The spectral parameters obtained by applying the models used for Panels B and D to XMM-Newton and Suzaku data are reported in columns 2 and 3 of Table 1, respectively. Bottom panel: ratios obtained using blurred reflection models. Panels E and F show the ratios obtained by fitting the data with a relativistic broad Fe Kα line (Sect. 4.2), while Panels G and H those obtained assuming a blurred ionized reflection scenario. The spectral parameters obtained by applying the models used for Panels F and H to XMM-Newton and Suzaku spectra are reported in columns 2 and 3 of Table 2, respectively.

representing emission from neutral Fe Kα and from Fe xxv and Fe xxvi, with energies fixed at 6.40 keV, 6.70 keV and 6.97 keV, respectively. This improves significantly the fit (Δχ^2 ≃ 80 for three extra DOF), but leaves significant residuals between 4 and 6 keV (panel B).

To include reflection from neutral material, we used the

PEXRAV model (Magdziarz & Zdziarski 1995), fixing the

cut-off energy to an arbitrary value (E_C = 300 keV) and the inclination angle to i = 30^∘. Leaving i free to vary does not improve the fit. We fixed the values of the photon index and normalisation to those of the X-ray continuum, and considered only the reflection component, leaving the reflection parameter (R = Ω/2π, where Ω is the solid angle of the reflector) free to vary. We first tested the scenario in which the reflector is outside the line of sight of the clumpy neutral absorber (external reflection^{12}), as it would be expected if most of the reprocessed X-ray radiation is produced in the molecular torus. This improved the fit (Δχ^2 ≃ 16 for one extra DOF), although it left residuals below 6 keV and it resulted in a value of the reflection parameter of R = 3.8^{+0.6}_{−0.5}. This appears to

12 TBABS_{Gal} ×(ZPCFABS×ZPOW + PEXRAV +3×ZGAUSS)

Suzaku observation of IRAS 00521−7054 5

Table 1 The table reports (1) the values of the parameters obtained by fitting the combined Suzaku and XMM-Newton spectra of IRAS 00521−7054 with: (2) a partially covering neutral absorber model (residuals for Suzaku data shown in panel B of Fig. 3 and the model is reported in footnote 11); (3) a double fully-covering ionized absorber model (panel D, footnote 17).

Absorption models

(1) (2) (3)

Model Parameters Partially Covering Neutral absorber Two Ionized absorbers

ZPOW: Photon index Γ 1.98^{+0.03}_{−0.03} 2.22^{+0.10}_{−0.12}

ZPCFABS: Col. density N_H [10^{22} cm^{−2}] 7.3^{+0.2}_{−0.2} –

ZPCFABS: Cov. factor f_C [%] 99.2^{+0.1}_{−0.1} –

MTABLE{XSTAR(1)}: Col. density N^{W, 1}_H [10^{22} cm^{−2}] – 27^{+5}_{−4}

MTABLE{XSTAR(1)}: Ioniz. par. log ξ^1 [ erg cm s^{−1}] – 0.64^{+0.13}_{−0.19}

MTABLE{XSTAR(2)}: Col. density N^{W, 2}_H [10^{22} cm^{−2}] – 34^{+69}_{−32}

MTABLE{XSTAR(2)}: Ioniz. par. log ξ^2 [ erg cm s^{−1}] – 3.1^{+0.4}_{−0.6}

BB: Temperature kT_e – 0.10^{+0.05}_{−0.03}

PEXRAV: Reflection param. R – 1.9^{+0.6}_{−1.2}

ZGAUSS: Energy(Fe Kα) [keV] 6.40^∗ 6.40^∗

ZGAUSS: EW(Fe Kα) [eV] 81^{+14}_{−14} 61^{+18}_{−14}

ZGAUSS: Energy(Fe Kβ) [keV] – 7.24^{+0.10}_{−0.11}

ZGAUSS: EW(Fe Kβ) [eV] – 34^{+20}_{−16}

ZGAUSS: Energy(Fe xxv) [keV] 6.70^∗ 6.70^∗

ZGAUSS: EW(Fe xxv) [eV] 64^{+9}_{−11} 77^{+15}_{−15}

ZGAUSS: Energy(Fe xxvi) [keV] 6.97^∗ 6.97^∗

ZGAUSS: EW(Fe xxvi) [eV] 39^{+11}_{−13} 25^{+19}_{−14}

χ^2/DOF 1168.5/1052 1104.1/1045

Notes.^∗ value of the parameter fixed.

be not consistent with the EW of the narrow Fe Kα line (∼ 60 eV). To compare the Fe Kα EW with the value of the reflection parameter we computed the EW of the line with respect to the reflection component (EW^{refl}). We obtained EW^{refl} ≃ 160 eV, a value much lower than that expected theoretically (1–2 keV, Matt et al. 1991).

We then tested the scenario in which the reflected emission is also seen through the neutral patchy absorber (internal reflection^{13}), as it would be expected if the absorption is due to the host galaxy, or if the bulk of the reprocessed emission comes from the outer part of the accretion disk. In this case we obtained a better value of the reduced chi-squared (χ^2/DOF = 783.5/748), although the fit leaves significant residuals at E ≃ 5 keV. Moreover, the fit results in a very large value of the reflection component (R = 4.9^{+0.9}_{−0.4}), which is inconsistent with the EW of the narrow Fe Kα line.

To better constrain the parameters, we fitted simultaneously the spectra obtained by Suzaku (FI-XIS, BI-XIS) and the two XMM-Newton (PN, MOS1 and MOS2) observations with the model reported in Panel B of Fig. 3 (partially covering neutral absorber plus three narrow emission lines). We added multiplicative factors to take into account the cross-calibration between the different detectors, and for possible flux variability between the different observations. For all the spectra the value of

13 TBABS_{Gal} ×(ZPCFABS×PEXRAV+3×ZGAUSS)

the factor turned out to be close to one within a few percent, as expected from the lack of long-term variability discussed in Sect. 3. The values of the parameters obtained are listed in column 2 of Table 1. In all the fits described above we obtained values of the covering factor of the neutral absorber of 95 − 99%. This makes this model indistinguishable from one including an absorbed power-law plus a component due to scattered emission, since the amplitude of the scattered emission is usually of a few percents (see Sect. 4.2.2).

Based on the analysis reported in this section, we can therefore exclude that a partially covering neutral absorber model can reproduce the broad feature observed in the X-ray spectrum of IRAS 00521−7054.

4.1.2. Ionized absorption

Ionized absorption could distort the continuum in such a way that it would mimic the shape of an intrinsically broad Fe Kα line (e.g., Turner & Miller 2009 and references therein). Miyakawa et al. (2012, see also Inoue & Matsumoto 2003, Miyakawa et al. 2009 and Inoue et al. 2011) recently proposed, to explain the broad line observed in the X-ray spectrum MCG-6-30-15, a model consisting of a power-law plus reflection from neutral material, obscured by three different absorbers, one fully covering and two partially covering the X-ray source, with different values of the ionization parameter and of the column density. In their model X-ray reflec-

6 Ricci et al.

tion was observed as the superposition of a Compton hump and two narrow Gaussian lines, representing Fe Kα and Fe Kβ fluorescent emission.

We tested whether ionized absorption might explain the broad feature observed in the X-ray spectrum of IRAS 00521−7054. To take into account ionized absorption, we used the same grid of XS- TAR (Kallman & Bautista 2001; Bautista & Kallman 2001) photoionized absorption models adopted by Miyakawa et al. (2012). This XSTAR table model assumes a photon index of the primary X-ray continuum of Γ = 2, and that the warm absorber has a solar abundance, a temperature of 10^5 K, a pressure of 0.03 dyn cm^{−2} and a density of 10^{12} cm^{−3}. The choice of Γ does not affect the results because of the weak dependence of the XSTAR model on this parameter. The free parameters of the absorber are the column density of the ionized material (N^W_H ) and its ionization parameter (ξ). For all the models we obtained a value of the covering factor consistent with unity, and we therefore discarded the hypothesis that the ionized medium partially covers the X-ray source.

We started by taking into account one layer of ionized absorption, including both reflection from neutral material and two narrow lines (Fe Kα and Fe Kβ)^{14}. The fit yields χ^2/DOF = 773.5/748, and leaves significant residuals between 5 and 6 keV and around 7 keV (Panel C of Fig. 3). Adding to the model two narrow Gaussian lines with energies fixed to 6.70 and 6.97 keV, representing Fe xxv and Fe xxvi, respectively^{15}, improves the fit (Δχ^2 ≃ 12), and reduces the residuals in the iron line region. While the presence of Fe xxv and Fe xxvi emission lines improves significantly the fit, it must be stressed that some degeneracy exists between these lines and the absorption features of the ionized absorber, which have the same energy. A second layer of ionized material^{16} improves the fit (Δχ^2 ≃ 6), but the model still leaves significant residuals below 2 keV. These residuals can be taken into account by adding a blackbody component^{17}, which produces the best fit (χ^2 = 734.0 for 742 DOF, Panel D) to the data using absorption models. This model, together with the Suzaku data, is shown in Fig. 4. Fitting simultaneously the spectra obtained by Suzaku and the two XMM-Newton observations with the two ionized absorbers model we obtained that the fit yields a good value of the reduced-chi squared (χ^2/DOF=1104.1/1045). The values of the parameters obtained are listed in column 3 of Table 1.

The ionization stage of the material producing the Fe Kβ line can be deduced from the energy centroid of the line (E_{Kβ} , e.g., Yaqoob et al. 2007; Palmeri et al. 2003), bearing in mind that iron must be less ionized than Fe xvii to produce Kβ lines, because Fe xvii and ions with higher ionization states lack M shell electrons. Comparing the value of E_{Kβ} with theoretical predictions (see e.g. Fig. 2 of Liu et al. 2010) we found that the Fe Kβ line is consistent with being emitted by Fe xiv–Fe xvi.

14 TBABS_{Gal} ×[MTABLE(XSTAR)×ZPO + PEXRAV + 2×ZGAUSS] 15 TBABS_{Gal} ×[MTABLE(XSTAR)×ZPO + PEXRAV + 4×ZGAUSS] 16 TBABS_{Gal} ×[MTABLE(XSTAR)×MTABLE(XSTAR)×ZPO + PEXRAV

+ 4×ZGAUSS]

17 TBABS_{Gal} ×[MTABLE(XSTAR)×MTABLE(XSTAR)×ZPO + BB +

PEXRAV + 4×ZGAUSS]

Figure 4. Suzaku spectrum of IRAS 00521−7054 together with the ionized absorption model (power-law continuum seen through two layers of ionized material, plus neutral reflection, a blackbody and four narrow lines representing Fe Kα, Fe Kβ, Fe xxv and Fe xxvi lines). The ratio between the data and the model associated to this figure is shown in panel D of Fig. 3.

The energy of the Fe Kα line (E_{Kα}) is less sensitive to the ionization stage of the iron. Leaving E_{Kα} free to vary does not significantly improve the fit (Δχ^2 ≃ 1), and results in E_{Kα} = 6.43^{+0.04}_{−0.06} keV, which is also consistent with being produced by Fe xiv–Fe xvi as well as by neutral iron. The ratio between the intensity of the Fe Kβ and Fe Kα (I_{Kβ} /I_{Kα}) line is expected to vary between 0.12 and 0.20, depending on the ionization stage of the iron (Palmeri et al. 2003; Mendoza et al. 2004). Applying the best ionized absorption model we obtained that I_{Kβ} /I_{Kα} ranges between 0.03 and 0.50, which is in agreement with the theoretical predictions, but cannot be used to constrain the ionization stage.

4.2. Blurred reflection

Ionized reflection from the accretion disk, blurred by relativistic effects in the proximity of the SMBH, could be the mechanism responsible for the broad iron lines (e.g., Reynolds & Nowak 2003). Applying physical models of blurred reflection, broad iron lines might be used to infer the spin of the SMBH (e.g, Dovčiak et al. 2004, Brenneman & Reynolds 2006, Reynolds & Fabian 2008, Brenneman et al. 2011, Patrick et al. 2012, Reynolds 2013), which is of crucial importance to constrain the radiative efficiency of accretion (e.g., Trakhtenbrot 2014).

In the following we will first discuss the results obtained by adopting a model which considers a broad relativistic iron line (Sect. 4.2.1), and then we will apply a more physical scenario, adding to the absorbed powerlaw emission a blurred ionized reflection component from the accretion flow (Sect. 4.2.2).

4.2.1. Broad line

As a first test, we added to the absorbed power-law continuum a broad relativistic line using the RELLINE model (Dauser et al. 2010, 2013), fixing the energy of the line to 6.4 keV. The model assumes a reflection emissivity of the type ϵ(r) = r^{−q1} for r < R_{break}, and ϵ(r) = r^{−q2} for r > R_{break}, where r is the distance from the SMBH. The free parameters of RELLINE are the inclination angle of the observer with respect to the accretion disk (i), the spin of the SMBH (a), the inner (q_1) and outer (q_2) emis-

Suzaku observation of IRAS 00521−7054 7

Table 2 The table reports (1) the values of the parameters obtained by fitting the combined Suzaku and XMM-Newton spectra with: (2) a model which considers an absorbed power-law continuum and a broad relativistic Fe Kα line (residuals for Suzaku data shown in panel F of Fig. 3, model reported in footnote 20); (3) an absorbed blurred ionized reflection model (panel H, footnote 21).

Blurred reflection models

(1) (2) (3)

Model Parameters Broad line Blurred ionized reflection

ZPOW: Photon index Γ 1.99^{+0.07}_{−0.08} –

CONST: f_{scatt} [%] 0.8^{+0.1}_{−0.1} 0.7^{+0.1}_{−0.1}

ZTBABS: Col. density N_H [10^{22} cm^{−2}] 6.9^{+0.3}_{−0.3} 7.2^{+0.3}_{−0.3}

RELLINE: Energy [keV] 6.40^∗ –

RELLINE: Index q_1 = q_2 3^∗ –

RELLINE: Spin a ≥ 0.78 –

RELLINE: Inclination angle i [deg] 41^{+2}_{−2} –

RELLINE: EW [eV] 798^{+152}_{−102} –

RELXILL: Photon index Γ – 2.28^{+0.25}_{−0.11}

RELXILL: Index q_1 = q_2 – 3.1^{+0.5}_{−0.4}

RELXILL: Spin a – ≥ 0.73

RELXILL: Inclination angle i [deg] – 40^{+2}_{−3}

RELXILL: Iron abundance Z_{Fe} [Fe/solar] – 2.6^{+2.1}_{−1.0}

RELXILL: Ioniz. par. log ξ [ erg cm s^{−1}] – 2.0^{+0.4}_{−2.0}

RELXILL: Reflection par. – 2.7^{+2.5}_{−1.3}

ZGAUSS: Energy(Fe Kα) [keV] 6.40^∗ 6.40^∗

ZGAUSS: EW(Fe Kα) [eV] 25^{+11}_{−14} 28^{+13}_{−21}

ZGAUSS: Energy(Fe Kβ) [keV] 7.21^{+0.17}_{−0.33} 7.20^{+0.09}_{−0.09}

ZGAUSS: EW(Fe Kβ) [eV] 28^{+18}_{−17} ≤ 33

χ^2/DOF 1105.3/1049 1100.5/1046

Notes.^∗ value of the parameter fixed.

sivity index of the disk, the radius at which the emissivity index changes (R_{break}), and the inner (R_{in}) and outer (R_{out}) radius of the disk. The model allows different profiles of the angular emission M(μ_e), where μ_e = cos θ_e, and θ_e is the emission angle (see Svoboda et al. 2009). In particular, in RELLINE it is possible to adopt a limbdarkening law (M(μ_e) = 1 + 2.06μ_e, Laor 1991), an isotropic emission (M(μ_e) = 1) or a limb-brightening law (M(μ_e) = ln(1+μ_e), Haardt 1993). In the following, unless otherwise stated, we will adopt the limb-darkening law for consistency with the other relativistic iron line models (e.g., Laor 1991, Brenneman & Reynolds 2006). In RELLINE the radius of the inner stable circular orbit (R_{ISCO}) scales with the spin of the SMBH. We assumed that R_{in} = R_{ISCO}, R_{out} = 400 r_G (where r_G is the gravitational radius of the SMBH), and took into account the soft excess using a scattered component^{18} (see Sect. 4.2.2 for details), which yields a better fit than a blackbody component (Δχ^2 ≃ 2). For a flat disk irradiated by a central point source one would expect ϵ(r) ∝ r^{−3}. Therefore we applied RELLINE fixing R_{break} to an arbitrary value, and the emissivity indices to q_1 = q_2 = 3. The fit yields χ^2/DOF=753.9/749, and shows residuals in the Fe Kα region (Panel E of Fig. 3). Adding a Gaus-

18 TBABS_{Gal} ×[f_{scatt}×ZPOW + ZTBABS×(ZPOW + RELLINE)]

sian line^{19}, fixing the energy to 6.4 keV and the width to σ = 1 eV improves significantly the fit (Δχ^2 = 4.5), however a visual inspection of the residuals still shows that the model underestimates the data in the 7–8 keV region. This could be explained by the presence of a narrow Fe Kβ line, associated to the narrow Fe Kα. Adding a second Gaussian line^{20}, with the width fixed to 1 eV and the energy left free to vary, improves significantly the fit (Δχ^2 = 9), and removes any residual in the 6–8 keV region (panel F). However, the ratio between the intensity of the two lines is I_{Kβ} /I_{Kα} ≳ 0.33, larger than the maximum possible value (see Sect. 4.1.2). This might be related to the drop of the broad line flux above ∼ 7.1 keV. The parameters obtained by fitting Suzaku and XMM- Newton data with this model are reported in column 2 of Table 2.

Assuming a limb-brightening or an isotropic emission of the disk (Δχ^2 = 0.4 and Δχ^2 = −0.1, respectively), or relaxing the assumption on the emissivity indices, and letting them free to vary (assuming q_1 = q_2; Δχ^2 = 0.6), does not significantly improve the fit, and results in

19 TBABS_{Gal} ×[f_{scatt}×ZPOW + ZTBABS×(ZPOW + RELLINE) +

ZGAUSS]

20 TBABS_{Gal} ×[f_{scatt}×ZPOW + ZTBABS×(ZPOW + RELLINE) +

2×ZGAUSS]

8 Ricci et al.

Figure 5. Suzaku spectrum of IRAS 00521−7054 fitted with the blurred reflection model (absorbed power-law emission plus absorbed blurred reflection, two narrow Fe Kα and Fe Kβ lines, and a scattered component). The ratio between the data and the model associated to this figure is shown in panel H of Fig. 3.

values of the parameters consistent with those reported above.

4.2.2. Ionized reflection

To self-consistently reproduce all the reflection features arising in an ionized disk, and blurred by the proximity of the SMBH, we used the recently developed RELXILL model (García et al. 2014; Dauser et al. 2013). RELXILL is created by the convolution of the

XILLVER ionized reflection model (García & Kallman

2010; García et al. 2011, 2013) with RELCONV, the convolution kernel associated to RELLINE (Dauser et al. 2010). While previous ionized reflection models, such as REFLIONX (Ross & Fabian 2005), provided angleaveraged solutions for the reprocessed emission, XILLVER calculates the emission angle for each point of the accretion disk. The simulations carried out to create XILLVER have shown that the profile of the angular emission depends on the ionization state of the disk, and follows the limb-brightening law, although not in the form usually taken into account (see Sect. 4.2.1). García et al. (2014) have shown that, while the values of the spin and of the inclination angle obtained are similar using

KDBLUR(REFLIONX) and RELXILL, the value of the iron

abundance (Z_{Fe}) was overestimated by up to a factor of two when computed using KDBLUR(REFLIONX).

The free parameters of RELXILL are i, Z_{Fe}, Γ, the ionization parameter of the disk (ξ), the fraction of reflected flux (R, defined as for PEXRAV), R_{in}, R_{out}, q_1, q_2, R_{break}, and the cutoff energy (E_C). As our spectra are limited to E ≲ 10 keV we assumed E_C = 300 keV. Following what was done in Sect. 4.2.1 we assumed that the inner radius is the inner stable circular orbit (i.e. R_{in} = R_{ISCO}), R_{out} = 400 r_G, we added to the model two narrow Gaussian lines to take into account the Fe Kα and Fe Kβ emission, and we used a scattered component for the soft-excess^{21}. The scattered flux was taken into account using a power-law emission multiplied by a constant (f_{scatt}), with both photon index and normalisation fixed to the values of the primary power-law. The scattered emission is believed to arise in circumnuclear material, and represents a fraction of typically few percent

21 TBABS_{Gal} ×(f_{scatt}×ZPOW + ZTBABS×RELXILL + 2×ZGAUSS)

Figure 6. Δχ^2 for different values of the spin of the SMBH (a) of IRAS 00521−7054. The values of a span from the maximally counter-rotating (a = −1) to the maximally rotating (a = 1) scenario. The Δχ^2 distribution was obtained by fitting the combined Suzaku and XMM-Newton spectra with RELXILL (Sect. 4.2.2 and column 3 of Table 2). As discussed in Sect. 4.2.2, by considering that R = 2.7^{+2.5}_{−1.3} and using the recent theoretical results of Dauser et al. (2014), we can exclude all the solutions for which a ≤ 0.5 (red vertical dotted line), which implies that the only possible solution is a ≥ 0.73.

of the primary X-ray emission (e.g., Cappi et al. 2006), although in some cases it has been found to be below 1 % (Ueda et al. 2007; Eguchi et al. 2009).

Fitting the broad-band Suzaku spectrum, setting the emissivity index of the accretion flow to q_1 = q_2 = 3, we obtained χ^2/DOF = 737.2/744 (panel G of Fig. 3). Relaxing the assumption on q_1 = q_2 and leaving the parameter free to vary improves significantly the fit (Δχ^2 = 3.6, panel H). This model can reproduce very well the spectrum in the 5–8 keV region, and provides the best fit with reflection models to the Suzaku spectrum of IRAS 00521−7054. The presence of the Fe Kβ line is marginally significant (Δχ^2 ≃ 5 for two extra DOF), and we obtained only an upper limit on its EW. Similarly to what we found by applying the ionized absorption model (see Sect. 4.1.2), we obtained that the energy of the Fe Kβ line and the ratio between the intensity of the Fe Kβ and Kα lines (I_{Kβ} /I_{Kα} ≃ 0.10 − 0.78) are consistent with the line being emitted by ionized iron, although in this case we found a larger range of ionization states (Fe xii–Fe xvi). In Fig. 5 we illustrate the Suzaku spectrum of IRAS 00521−7054 together with the different spectral components obtained by the best fit.

Adding reflection from neutral material^{22} does not improve the chi-squared (Δχ^2 ≃ 0) and results in a reflection parameter of R < 2.1. Leaving the energy of the Fe Kα line free to vary does not affect the chi-squared (Δχ^2 ≃ 0.1), and results in E_{Kα} = 6.39^{+0.06}_{−0.06} keV. To self-consistently reproduce the Compton hump, the Fe Kα and Fe Kβ line produced in neutral material we used the pexmon model (Nandra et al. 2007)^{23}, which assumes a slab geometry for the reprocessing material. This model yields a worse fit than that obtained by combining pexrav with two Gaussian lines (χ^2 = 738.8 for 745 DOF), and results in a value of the reflection param-

22 TBABS_{Gal} ×(f_{scatt}×ZPOW + ZTBABS×RELXILL + 2×ZGAUSS +

PEXRAV)

23 TBABS_{Gal} ×(f_{scatt}×ZPOW + ZTBABS×RELXILL + PEXMON)

Suzaku observation of IRAS 00521−7054 9

Figure 7. Top panel: ratio between Suzaku FI-XIS data and the fit obtained by applying a simple absorbed power-law model (TBABS_{Gal} ×ZTBABS×ZPOW) to the data in the 2–4.5 keV and 7.5–10 keV range. The three spectra represent different flux levels of the source (see Fig. 1). The red dashed line represents the ratio between the best model obtained by fitting the spectra with a power-law absorbed by two layers of ionized material plus neutral reflection and four Gaussian lines (see Panel D of Fig. 3), freezing all the parameters to the values obtained by fitting the average spectrum except the power-law normalisation, and the absorbed power-law model. Bottom panel: same as top panel for the blurred reflection scenario. The red dashed line represents the ratio between the best model obtained by fitting the spectra with a broad line model (see Panel H of Fig. 3), freezing all the parameters to the values obtained by fitting the average spectrum, leaving only the power-law normalisation free to vary, and the absorbed power-law model.

eter of R = 0.6^{+0.3}_{−0.4}.

To better constrain the parameters, we simultaneously fitted, as done in Sect. 4.1.2, the Suzaku and the two XMM-Newton observations with our best blurred ionized reflection model. For all the spectra we obtained values of the multiplicative factors close to unity within a few percents. The values of the parameters obtained are listed in column 3 of Table 2. The fact that we only obtained an upper limit on the ionization parameter of the disk is caused by the lack of photons below 2 keV, which are strongly absorbed by the obscuring material in the line of sight. The soft X-ray band gives in fact important constraints on ξ, thanks to the large number of atomic transitions.

From our combined fit we obtained that the value of the reflection parameter associated to the ionized disk exceeds unity (R = 2.7^{+2.5}_{−1.3}), which might imply that light-bending is at play (e.g., Martocchia & Matt 1996; Miniutti & Fabian 2004; Gandhi et al. 2007). In the light-bending scenario the X-ray source is located very close to the SMBH, so that part of the powerlaw emission is bent towards the disk, which diminishes the observed primary emission and increases the fraction of reprocessed radiation. In Fig. 6 we illustrate the value of Δχ^2 for different values of the spin. We found three possible solutions for the spin of the SMBH: a ≤ −0.5, a = 0.3 ± 0.2 and a ≥ 0.73 (Fig.6). Recently, Dauser et al. (2014) calculated the maximum possible value of the reflection parameter R for a certain value of the spin in the lamp post geometry. Considering that the reflection parameter of IRAS 00521-7054 is in the range 1.4 ≤ R ≤ 5.2, and keeping the assumption R_{in} = R_{ISCO}, from Fig. 3 (left panel) of Dauser et al. (2014) we can deduce that the spin of the SMBH must be a ≥ 0.50. This excludes the retrograde and intermediate-spin solutions, and implies that a ≥ 0.73.

5. TIME-RESOLVED SPECTRAL ANALYSIS

As discussed in Sect. 3, IRAS 00521−7054 is rather variable in the 2–10 keV band on a time-scale of few ks. To study the relationship between flux and spectral variations, we performed time-resolved spectral analysis, di-

10 Ricci et al.

viding the light-curve into three different states: high, mean and low (see Fig. 1). For each flux state we created FI-XIS and BI-XIS spectra, modifying the good time intervals to take into account only one flux state at the time, and adopting the same procedure for the data reduction described in Sect. 2.1.

As a first test we fitted each of the three spectra in the 2–4.5 keV and 7.5–10 keV range (in the rest frame of the source) using a simple absorbed power-law model^{24}. The values of Γ and N_H obtained for the three different spectra are consistent within their uncertainties, and we can therefore exclude that different flux levels are related to changes of the neutral absorber. In Fig. 7 we illustrate the ratio between the data and the absorbed power-law model for each of the three spectra. The figure shows that the strength of the excess around 6 keV decreases for increasing values of the flux.

We fitted the three spectra with the best absorption model discussed in Sect. 4.1.2 and shown in Panel D of Fig. 3 (power law obscured by two ionized absorbers plus reflection from neutral material, a blackbody component, and four narrow emission lines representing Fe Kα, Fe Kβ, Fe xxv and Fe xxvi), fixing all the parameters to the values obtained by fitting the average Suzaku spectrum, leaving only the normalization of the power-law continuum free to vary. The fits yield good values of the reduced chi-squared: χ^2/DOF=123.2/127, 428.5/431 and 248.2/255 for the low, mean and high flux state, respectively. The fit to the spectra is represented by the red dashed lines in Fig. 7 (top panel). This is consistent with a scenario in which only the X-ray continuum is varying, while the ionized absorbers and the four emission lines are constant, as expected in the case of a distant reflector that does not respond simultaneously to changes of the X-ray continuum emission. This is different from the model proposed by Miyakawa et al. (2012), which explains X-ray variability as being solely due to variations of the covering factor of the ionized absorbers.

We then fitted the three spectra with the best broad Fe Kα line model presented in Sect. 4.2.1 and shown in Panel F of Fig. 3 (absorbed power-law plus broad Fe Kα line and narrow Fe Kα and Fe Kβ lines), fixing all the parameters and allowing only the normalization of the power-law continuum to vary. Also in this case we obtained good values of the reduced chisquared: χ^2/DOF=122.1/127, 428.2/431 and 248.2/255 for the low, mean and high flux state, respectively (bottom panel of Fig. 7). The EW of the broad line is measured as in Sect. 4.1, and it decreases for increasing values of the flux, and is 1070 ± 30 eV, 787 ± 12 eV, 620 ± 11 eV for the low, mean and high flux state, respectively. The uncertainties associated to these values are lower than those reported in Table 2 because most of the parameters were frozen to their average values. The flux of the broad line in the three observations is constant (f_{Kα} ≃ 1.9 × 10^{−13} erg cm^{−2} s^{−1}), and corresponds to a luminosity of L_{Kα} ≃ 2.2 × 10^{42} erg s^{−1}. The time-scale we are probing (∼ 6 ks) is longer than the time delay usually found between the broad Fe Kα and the X-ray continuum (∼ 0.05 − 2 ks for black hole masses M_{BH} ≲ 10^8M_⊙, e.g., Zoghbi et al. 2012, 2013;

24 TBABS_{Gal} ×(ZTBABS×ZPOW)

Kara et al. 2013). Therefore, unless the black hole is extremely massive, we can conclude that the constant flux of the broad Fe Kα line is consistent with a scenario in which the reflecting material is not responding to the variations of the primary X-ray emission. This is in agreement with the idea that light-bending is at work in IRAS 00521−7054, as hinted also by the large value of the reflection parameter. Leaving the parameters of the broad line (q, a, i and normalisation) and of the primary X-ray emission (Γ and N_H) free improves only marginally the fits (Δχ^2 =2.6, 2.5 and 1.5 for the low, mean and high flux state, respectively), and we obtained that the three spectra have parameters consistent within their uncertainties.

6. DISCUSSION AND CONCLUSIONS

In this paper we studied the X-ray spectrum of IRAS 00521−7054, the first type-II AGN in which the presence of an extremely large Fe Kα line has been claimed, using new Suzaku data and archival XMM- Newton observations. We confirmed the existence of a strong excess at ∼ 6 keV above the power-law continuum, the largest ever observed in a Seyfert 2, and found that this feature could be explained by two different scenarios.

In the absorption scenario (Sect. 4.1.2) the X-ray power-law continuum is obscured by two layers of ionized material with similar column densities but different values of the ionization parameter. Besides this primary X-ray emission, the spectra require reflection from neutral material, possibly associated with the molecular torus, a blackbody component and four emission lines corresponding to Fe Kα, Fe Kβ, Fe xxv and Fe xxvi.

In the reflection scenario (Sect. 4.2) the X-ray source is obscured by neutral material (log N_H ∼ 22.9), and shows a strong (R = 2.7^{+2.5}_{−1.3}) blurred reflection component arising from an ionized disk around a rotating SMBH with a spin a ≥ 0.73. Two narrow lines representing emission from Fe Kα and Fe Kβ are also needed. The EW of the narrow Fe Kα line is consistent with the value expected for an AGN with a luminosity of 2.5×10^{43} erg s^{−1} in the 2–10 keV band (Bianchi et al. 2007, Ricci et al. 2013a,b, see Fig. 7 of Ricci et al. 2013a). Our analysis shows that the reflecting material has a super-solar iron abundance (Z_{Fe} = 1.6 − 4.7 Z_⊙). This is consistent with what has been found by several other studies of this type carried out on objects showing broad Fe Kα lines (e.g., Fabian et al. 2012), although these previous studies used REFLIONX, which could over-predict the Fe abundance by up to a factor of two (García et al. 2014). An explanation to the high Fe abundance has been recently put forward by Reynolds et al. (2012), who proposed that the radiative levitation of iron ions in the innermost part of the accretion flow disks could increase the photospheric abundance of iron. In a recent work, Patrick et al. (2012) systematically studied broad Fe Kα lines by using Suzaku observations for a sample of 46 AGN. From their study they found an average emissivity index of the accretion disk of q = 2.4±0.1, lower than the value obtained for IRAS 00521−7054 (q = 3.1^{+0.5}_{−0.4}). The value of q we obtained is consistent with a scenario in which a flat disk is illuminated by a central point source. Patrick et al. (2012) found an average inclination angle

Suzaku observation of IRAS 00521−7054 11

with respect to the accretion disk of i = 33^∘ ±2^∘ for their sample of type-I AGN, while de La Calle Pérez et al. (2010), studying XMM-Newton observations of bright Seyfert 1s, obtained i = 28^∘ ± 5^∘. Therefore it would seem that our results (i = 40^{+2}_{−3} deg) are consistent with IRAS 00521−7054 having a larger inclination angle than Seyfert 1s, as predicted by the unification model (e.g., Antonucci 1993). Interestingly, the inclination angle of IRAS 00521−7054 is consistent with that found for the obscured NLS1 NGC 5506 (i ≃ 40^∘, Guainazzi et al. 2010). Patrick et al. (2012) found that the average equivalent width of the broad lines of their sample is 97 ± 19 eV (Fig. 9 of their paper), with the strongest one being that associated to Mrk 79 (EW = 199^{+40}_{−37} eV). With an equivalent width of EW = 798^{+152}_{−102} eV, the broad feature of the Seyfert 2 IRAS 00521−7054 is one of the strongest detected so far in AGN, comparable to those observed in the narrow line Seyfert 1s IRAS 13224−3809 (Boller et al. 2003; Fabian et al. 2013) and 1H 0707−495 (Fabian et al. 2009), and to the lowflux state of MCG−6 − 30 − 15 (e.g., Fabian & Vaughan 2003). As discussed in Sect. 3, on the time-scale of a few years and of one month the source does not seem to vary, as the flux level of the Suzaku observation is the same as that measured by the two XMM-Newton observations carried out in March and April 2006. This seems to exclude that the source was in a low-flux state at the time of the Suzaku observation, which could account for the very large EW observed. Therefore, IRAS 00521−7054 might be one of the very few obscured AGN to show evidence of strong light-bending.

In both scenarios we found that the energy centroid of the Fe Kβ line, and the ratio between the Fe Kβ and Kα intensities, are consistent with the narrow iron lines being produced by ionized iron. The ionization state of the iron is Fe xiv–Fe xvi for the ionized absorption model, while in the blurred reflection scenario is Fe xii– Fe xvi, although in this case the presence of a Fe Kβ line is only marginally significant. The material producing these narrow features might therefore be associated with the outer skin of the molecular torus or with the BLR.

While the X-ray continuum is variable in the time-scale of a few kiloseconds, the broad feature at ∼ 6 keV appears to be constant on a time scale of ∼ 6 ks. This lack of variability is consistent with both scenarios (Sect. 5); for the ionized absorption model it fits the idea that the reprocessing material is associated with distant material, while in the case of the reflection scenario this would point towards light-bending, consistently with the fact that the reflection parameter is larger than one.

In both scenarios we obtained a steep power-law emission, with a photon index of Γ ≃ 2.2 − 2.3 (Column 3 of tables 1 and 2), consistent with the value reported by Tan et al. (2012), and significantly larger than the average value of type-II AGN (Γ ∼ 1.8 − 1.9, Beckmann et al. 2009; Ricci et al. 2011). Given the positive correlation between Γ and the Eddington ratio (λ_{Edd}, e.g. Shemmer et al. 2008), this might imply that the source is accreting at higher values of λ_{Edd} than typical type-II AGN. Spectropolarimetric studies did not find any evidence of a broad Hα line (Young et al. 1996), although Tran (2001, 2003) erroneously reported IRAS 00521−7054 as a source showing broad lines in polarised light. The presence of polarised broad lines would exclude that the source is an obscured NLS1. NLS1s tend to have lower black hole masses and accrete at higher values of λ_{Edd} than type-I AGN, which leads them to show steeper primary X-ray emission. NLS1s also usually show strong reflection features from the innermost part of the accretion flow (e.g., Gallo 2006; Fabian et al. 2009). NGC 5506 was also classified as a type-II AGN with polarised broad lines (Tran 2001, 2003), while this object was later found, by using near-IR spectroscopy, to be the first obscured NLS1 (Nagar et al. 2002). NLS1s are typically identified based on their optical properties: they show Fe II emission lines, a ratio [OIII]/Hβ < 3 and FWHM(Hβ) < 2000 km s^{−1} (e.g., Komossa et al. 2006 and references therein). Due to the obscuring material in the line of sight we cannot infer the properties of the BLR, so that it is not possible to verify these criteria for IRAS 00521−7054. Considering that we can observe only the component of the Hβ produced in the narrow line region (NLR), which gives us a lower limit on the total Hβ flux, we can use the observed ratio [OIII]/Hβ(NLR) = 10 (Yu & Hwang 2011) as an upper limit on the value of [OIII]/Hβ. This does not allow us to confirm the NLS1 nature of IRAS 00521−7054, and more accurate near- IR and spectropolarimetric measurements are required to verify this possibility. So far only NGC 5506 has been confirmed to be an obscured NLS1, although, two other Seyfert 2s (NGC 7314 and NGC 7582) have been proposed to belong to this class (Dewangan & Griffiths 2005). IRAS 00521−7054 could therefore be the obscured counterparts of objects such as IRAS 13224−3809 and 1H 0707−495, although it lacks the sharp decrease in flux at 7 keV observed in these sources. Alternatively the source might be an intermediate object, i.e. a Seyfert 2 with a high accretion rate. However, if the source is a genuine true Seyfert 2 (i.e., an AGN without a BLR), this hypothesis would be in conflict with the prediction that the lack of a BLR is due to low values of the accretion rate (e.g., Nicastro 2000). If the Seyfert 2 nature of IRAS 00521−7054 were to be confirmed, this object would be the first type-II AGN to show evidence of strong light-bending.

The two scenarios discussed above to explain the Xray spectrum are statistically indistinguishable, and future observations of IRAS 00521−7054 will help shedding light on this very interesting source. In particular, with the advent of the high-resolution X-ray calorimeter on board ASTRO-H (Takahashi et al. 2010), it will possible to clearly detect absorption lines from ionized outflows in the Fe Kα region, and to break the degeneracy between absorption and reflection models.

We thank the anonymous referee for his/her comments, that helped us to improve the quality of our manuscript. We are grateful to M. Guainazzi, L. Gallo and F. Tombesi for useful discussion, to K. Ebisawa for kindly providing us with his XSTAR table model, to Y. Fukazawa for the new tuned Suzaku HXD/PIN background files and to Chin-Shin Chang and T. Kawamuro for their comments on the manuscript. This research has made use of data obtained from the Suzaku satellite, a collaborative mission between the space agencies of Japan (JAXA) and USA (NASA), and from XMM-Newton, an

12 Ricci et al.

ESA science mission with instruments and contributions directly funded by ESA Member States and NASA. CR is a Fellow of the Japan Society for the Promotion of Science (JSPS). This work was partly supported by the Grant-in-Aid for Scientific Research 26400228 (YU) from the Ministry of Education, Culture, Sports, Science and Technology of Japan (MEXT). This research has made use of the NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, of data obtained from the High Energy Astrophysics Science Archive Research Center (HEASARC), provided by NASA’s Goddard Space Flight Center, and of the SIM- BAD Astronomical Database which is operated by the Centre de Données astronomiques de Strasbourg.

Facilities: Suzaku, XMM-Newton.

REFERENCES

Antonucci, R. 1993, ARA&A, 31, 473 Arnaud, K. A. 1996, in Astronomical Society of the Pacific Conference Series, Vol. 101, Astronomical Data Analysis Software and Systems V, ed. G. H. Jacoby & J. Barnes, 17 Bautista, M. A., & Kallman, T. R. 2001, ApJS, 134, 139 Beckmann, V., Soldi, S., Ricci, C., et al. 2009, A&A, 505, 417 Bianchi, S., Guainazzi, M., Matt, G., & Fonseca Bonilla, N. 2007, A&A, 467, L19 Bianchi, S., La Franca, F., Matt, G., et al. 2008, MNRAS, 389, L52 Boller, T., Tanaka, Y., Fabian, A., et al. 2003, MNRAS, 343, L89 Brenneman, L. W., & Reynolds, C. S. 2006, ApJ, 652, 1028 Brenneman, L. W., Reynolds, C. S., Nowak, M. A., et al. 2011, ApJ, 736, 103 Cappi, M., Panessa, F., Bassani, L., et al. 2006, A&A, 446, 459 Dauser, T., Garcia, J., Wilms, J., et al. 2013, MNRAS, 430, 1694 Dauser, T., Wilms, J., Reynolds, C. S., & Brenneman, L. W.

2010, MNRAS, 409, 1534 de La Calle Pérez, I., Longinotti, A. L., Guainazzi, M., et al.

2010, A&A, 524, A50 Dewangan, G. C., & Griffiths, R. E. 2005, ApJ, 625, L31 Dewangan, G. C., Griffiths, R. E., & Schurch, N. J. 2003, ApJ, 592, 52 Dickey, J. M., & Lockman, F. J. 1990, ARA&A, 28, 215 Dovčiak, M., Karas, V., & Yaqoob, T. 2004, ApJS, 153, 205 Eguchi, S., Ueda, Y., Terashima, Y., Mushotzky, R., & Tueller, J.

2009, ApJ, 696, 1657 Fabian, A. C., Rees, M. J., Stella, L., & White, N. E. 1989, MNRAS, 238, 729 Fabian, A. C., & Vaughan, S. 2003, MNRAS, 340, L28 Fabian, A. C., Zoghbi, A., Ross, R. R., et al. 2009, Nature, 459, 540 Fabian, A. C., Zoghbi, A., Wilkins, D., et al. 2012, MNRAS, 419, 116 Fabian, A. C., Kara, E., Walton, D. J., et al. 2013, MNRAS, 429, 2917 Fukazawa, Y., Mizuno, T., Watanabe, S., et al. 2009, PASJ, 61, 17 Fukazawa, Y., Hiragi, K., Mizuno, M., et al. 2011, ApJ, 727, 19 Gabriel, C., Denby, M., Fyfe, D. J., et al. 2004, in Astronomical Society of the Pacific Conference Series, Vol. 314, Astronomical Data Analysis Software and Systems (ADASS) XIII, ed. F. Ochsenbein, M. G. Allen, & D. Egret, 759 Gallo, L. C. 2006, MNRAS, 368, 479 Gandhi, P., Fabian, A. C., Suebsuwong, T., et al. 2007, MNRAS, 382, 1005 García, J., Dauser, T., Reynolds, C. S., et al. 2013, ApJ, 768, 146 García, J., & Kallman, T. R. 2010, ApJ, 718, 695 García, J., Kallman, T. R., & Mushotzky, R. F. 2011, ApJ, 731, 131 García, J., Dauser, T., Lohfink, A., et al. 2014, ApJ, 782, 76 Gruber, D. E., Matteson, J. L., Peterson, L. E., & Jung, G. V.

1999, ApJ, 520, 124 Guainazzi, M., Bianchi, S., Matt, G., et al. 2010, MNRAS, 406, 2013 Haardt, F. 1993, ApJ, 413, 680 Inoue, H., & Matsumoto, C. 2003, PASJ, 55, 625

Inoue, H., Miyakawa, T., & Ebisawa, K. 2011, PASJ, 63, 669 Ishisaki, Y., Maeda, Y., Fujimoto, R., et al. 2007, PASJ, 59, 113 Iwasawa, K., Fabian, A. C., Mushotzky, R. F., et al. 1996, MNRAS, 279, 837 Kallman, T., & Bautista, M. 2001, ApJS, 133, 221 Kara, E., Fabian, A. C., Cackett, E. M., et al. 2013, MNRAS, 434, 1129 Komossa, S., Voges, W., Xu, D., et al. 2006, AJ, 132, 531 Koyama, K., Tsunemi, H., Dotani, T., et al. 2007, PASJ, 59, 23 Laor, A. 1991, ApJ, 376, 90 Liu, Y., Elvis, M., McHardy, I. M., et al. 2010, ApJ, 710, 1228 Lobban, A. P., & Vaughan, S. 2014, MNRAS, 439, 1575 Magdziarz, P., & Zdziarski, A. A. 1995, MNRAS, 273, 837 Makishima, K. 1986, in Lecture Notes in Physics, Berlin Springer Verlag, Vol. 266, The Physics of Accretion onto Compact Objects, ed. K. O. Mason, M. G. Watson, & N. E. White, 249 Martocchia, A., & Matt, G. 1996, MNRAS, 282, L53 Matt, G., Perola, G. C., & Piro, L. 1991, A&A, 247, 25 Mendoza, C., Kallman, T. R., Bautista, M. A., & Palmeri, P.

2004, A&A, 414, 377 Miniutti, G., & Fabian, A. C. 2004, MNRAS, 349, 1435 Miniutti, G., Ponti, G., Dadina, M., Cappi, M., & Malaguti, G.

2007, MNRAS, 375, 227 Mitsuda, K., Bautz, M., Inoue, H., et al. 2007, PASJ, 59, 1 Miyakawa, T., Ebisawa, K., & Inoue, H. 2012, PASJ, 64, 140 Miyakawa, T., Ebisawa, K., Terashima, Y., et al. 2009, PASJ, 61, 1355 Mushotzky, R. F., Fabian, A. C., Iwasawa, K., et al. 1995, MNRAS, 272, L9 Nagar, N. M., Oliva, E., Marconi, A., & Maiolino, R. 2002, A&A, 391, L21 Nandra, K., O’Neill, P. M., George, I. M., & Reeves, J. N. 2007, MNRAS, 382, 194 Nicastro, F. 2000, ApJ, 530, L65 Palmeri, P., Mendoza, C., Kallman, T. R., Bautista, M. A., & Meléndez, M. 2003, A&A, 410, 359 Patrick, A. R., Reeves, J. N., Porquet, D., et al. 2012, MNRAS, 426, 2522 Reynolds, C. S. 2013, Space Sci. Rev.

Reynolds, C. S., Brenneman, L. W., Lohfink, A. M., et al. 2012, ApJ, 755, 88 Reynolds, C. S., & Fabian, A. C. 2008, ApJ, 675, 1048 Reynolds, C. S., & Nowak, M. A. 2003, Phys. Rep., 377, 389 Ricci, C., Paltani, S., Awaki, H., et al. 2013a, A&A, 553, A29 Ricci, C., Paltani, S., Ueda, Y., & Awaki, H. 2013b, MNRAS, 435, 1840 Ricci, C., Ueda, Y., Ichikawa, K., et al. 2014a, A&A, 567, A142 Ricci, C., Ueda, Y., Paltani, S., et al. 2014b, MNRAS, 441, 3622 Ricci, C., Walter, R., Courvoisier, T. J.-L., & Paltani, S. 2011, A&A, 532, A102 Risaliti, G., Harrison, F. A., Madsen, K. K., et al. 2013, Nature, 494, 449 Ross, R. R., & Fabian, A. C. 2005, MNRAS, 358, 211 Shemmer, O., Brandt, W. N., Netzer, H., Maiolino, R., & Kaspi, S. 2008, ApJ, 682, 81 Shu, X. W., Yaqoob, T., Murphy, K. D., et al. 2010a, ApJ, 713, 1256 Shu, X. W., Yaqoob, T., & Wang, J. X. 2010b, ApJS, 187, 581 —. 2011, ApJ, 738, 147 Strüder, L., Briel, U., Dennerl, K., et al. 2001, A&A, 365, L18 Svoboda, J., Dovčiak, M., Goosmann, R., & Karas, V. 2009, A&A, 507, 1 Takahashi, T., Abe, K., Endo, M., et al. 2007, PASJ, 59, 35 Takahashi, T., Mitsuda, K., Kelley, R., et al. 2010, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 7732, Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series Tan, Y., Wang, J. X., Shu, X. W., & Zhou, Y. 2012, ApJ, 747, L11 Tanaka, Y., Nandra, K., Fabian, A. C., et al. 1995, Nature, 375, 659 Trakhtenbrot, B. 2014, ApJ, 789, L9 Tran, H. D. 2001, ApJ, 554, L19 —. 2003, ApJ, 583, 632 Turner, M. J. L., Abbey, A., Arnaud, M., et al. 2001, A&A, 365, L27 Turner, T. J., & Miller, L. 2009, A&A Rev., 17, 47

Suzaku observation of IRAS 00521−7054 13

Ueda, Y., Eguchi, S., Terashima, Y., et al. 2007, ApJ, 664, L79 Wilms, J., Allen, A., & McCray, R. 2000, ApJ, 542, 914 Yaqoob, T., George, I. M., Nandra, K., et al. 2001, ApJ, 546, 759 Yaqoob, T., Murphy, K. D., Griffiths, R. E., et al. 2007, PASJ, 59, 283

Young, S., Hough, J. H., Efstathiou, A., et al. 1996, MNRAS, 281, 1206 Yu, P.-C., & Hwang, C.-Y. 2011, AJ, 142, 14 Zoghbi, A., Fabian, A. C., Reynolds, C. S., & Cackett, E. M.

2012, MNRAS, 422, 129 Zoghbi, A., Reynolds, C., Cackett, E. M., et al. 2013, ApJ, 767, 121