arXiv:1408.4137v3 [astro-ph.SR] 9 Sep 2014

Astronomy & Astrophysics manuscript no. ferreiralopes_aa_wfcam © ESO 2018 April 11, 2018

The WFCAM multiwavelength Variable Star Catalog

C. E. Ferreira Lopes^1, I. Dékány^{2,3}, M. Catelan^{2,3}, N. J. G. Cross^6, R. Angeloni^{2,4,5}, I. C. Leão^1, and J. R. De Medeiros^1

1 Departamento de Física Teórica e Experimental, Universidade Federal do Rio Grande do Norte, 59072-970 Natal, RN, Brazil 2 Instituto de Astrofísica, Pontificia Universidad Católica de Chile, Av. Vicuña Mackenna 4860, 782-0436 Macul, Santiago, Chile 3 Millennium Institute of Astrophysics, Santiago, Chile 4 Centro de Astro-Ingeniería, Pontificia Universidad Católica de Chile, Santiago, Chile 5 Max-Planck-Institut für Astronomie, Königstuhl 17, 69117 Heidelberg, Germany 6 SUPA (Scottish Universities Physics Alliance) Wide-Field Astronomy Unit, Institute for Astronomy, School of Physics and Astronomy, University of Edinburgh, Royal Observatory, Blackford Hill, Edinburgh EH9 3HJ, UK

Received ; accepted

ABSTRACT

Context. Stellar variability in the near-infrared (NIR) remains largely unexplored. The exploitation of public science archives with data-mining methods offers a perspective for a time-domain exploration of the NIR sky.

Aims. We perform a comprehensive search for stellar variability using the optical-NIR multiband photometric data in the public Calibration Database of the WFCAM Science Archive (WSA), with the aim of contributing to the general census of variable stars and of extending the current scarce inventory of accurate NIR light curves for a number of variable star classes. Methods. Standard data-mining methods were applied to extract and fine-tune time-series data from the WSA. We introduced new variability indices designed for multiband data with correlated sampling, and applied them for preselecting variable star candidates, i.e., light curves that are dominated by correlated variations, from noise-dominated ones. Preselection criteria were established by robust numerical tests for evaluating the response of variability indices to the colored noise characteristic of the data. We performed a period search using the string-length minimization method on an initial catalog of 6551 variable star candidates preselected by variability indices. Further frequency analysis was performed on positive candidates using three additional methods in combination, in order to cope with aliasing.

Results. We find 275 periodic variable stars and an additional 44 objects with suspected variability with uncertain periods or apparently aperiodic variation. Only 44 of these objects had been previously known, including 11 RR Lyrae stars on the outskirts of the globular cluster M3 (NGC 5272). We provide a preliminary classification of the new variable stars that have well-measured light curves, but the variability types of a large number of objects remain ambiguous. We classify most of the new variables as contact binary stars, but we also find several pulsating stars, among which 34 are probably new field RR Lyrae, and 3 are likely Cepheids. We also identify 32 highly reddened variable objects close to previously known dark nebulae, suggesting that these are embedded young stellar objects. We publish our results and all light curve data as the WFCAM Variable Star Catalog.

Key words. Catalogs – Stars: binaries: eclipsing – Stars: variables: Cepheids – Stars: variables: RR Lyrae – Stars: variables: general – Infrared: stars

1. Introduction

Time-varying celestial phenomena in general represent one of the most substantial sources of astrophysical information, and their study has led to many fundamental discoveries in modern astronomy. Pulsating stars provide insight into to stellar interiors through asteroseismology (e.g., Handler 2012) and serve as standard candles (e.g., Walker 2012), eclipsing binaries allow us to determine the most accurate stellar masses and radii (e.g., Clausen et al. 2008), and supernovae provide important means for estimating cosmological distances and probing the largescale structure of our Universe (e.g., Riess et al. 1998; Tonry et al. 2003) – just to mention some classical scopes among the countless aspects of time-domain astronomy.

The ever-growing interest in various astronomical timeseries data, as well as the tremendous development in astronomical instrumentation and automation during the past two decades, have been giving rise to several time-domain surveys of increasing scale. Wide-field shallow optical imaging surveys using small, dedicated telescope systems have been scanning the sky since the early 2000s with aims ranging from comprehensive stellar variability searches to exoplanet hunting, such as the Northern Sky Variability Survey (NSVS, Hoffman et al. 2009), All Sky Automated Survey (ASAS, Pojmanski 2002), Wide Angle Search for Planets (WASP, Pollacco et al. 2006), and the Hungarian Automated Telescope Network (HATnet, Bakos et al. 2004). The interest in transient events like microlensing have led to deeper, higher-resolution photometric campaigns such as the Massive Astrophysical Compact Halo Objects Survey (MA- CHO, Alcock et al. 1993) and the Optical Gravitational Lensing Experiment (OGLE, Udalski 2003), and to some ultra-wide surveys such as the Palomar Transient Factory (PTF, Law et al. 2009) or the Catalina Real-time Transient Survey (Drake et al. 2009). The development of imaging technology is leading toward deep all-sky surveys with seeing-limited resolution, and Pan-STARRS (Kaiser et al. 2002), representing the first generation of such programs, is already operational. In the near future, even more ambitious programs, such as the Large Synoptic Survey Telescope (LSST, Krabbendam & Sweeney 2010) and Gaia (Perryman 2005), are planned to start monitoring the optical sky. These synoptic surveys are expected to be the new powerhouses of modern astronomy by providing a high data flow for a wide

Article number, page 1 of 21 range of science applications, from the study of transients to understanding the dynamics of the Milky Way galaxy.

While optical synoptic surveys are getting wider and deeper, extending the systematic exploration of the variable sky toward other wavelengths, such as the infrared, is also indispensable, not only for a more complete understanding of the observed phenomena, but also for overcoming the problem of interstellar extinction. Infrared time-series photometry had long been constrained mostly to follow-up observations of known objects, but in recent years near-infrared (NIR) imagers have been converging to optical CCDs in terms of resolution and performance, hence wide-field surveys became feasible with some NIR instruments, such as the Wide-Field near-IR CAMera (WFCAM; Casali et al. 2007) on the 3.8m United Kingdom Infrared Telescope (UKIRT), and the VISTA InfraRed CAMera (VIRCAM; Dalton et al. 2006) on the 4.1m Visible and Infrared Survey Telescope for Astronomy (VISTA), both hosting a variety of deep Galactic and extragalactic surveys. Nevertheless there are only a handful of wide-field NIR time-domain surveys that have more than a handful of observational epochs, with only the VISTA Variables in the Vía Láctea survey (VVV; Minniti et al. 2010) being comparable to the optical ones in terms of both areal and time-domain coverage (e.g., Arnaboldi et al. 2007, 2012).

Besides the results from the large-scale surveys, valuable time-series data are also being generated by a variety of observational programs as sideproducts. Such data can well be quite heterogeneous and not always be complete completeness, since the original design of the data acquisition might have served various specific purposes. Nevertheless, multi-epoch data accumulated over a period of time from various observational programs using the same facility can hold vast unexploited information and represent a potential treasure trove for time-domain astronomy (see, e.g., the TAROT variable star catalog by Damerdji et al. 2007). An increasing number of observatories and projects realize the importance of standardizing their archives and incorporating them into the Virtual Observatory, allowing the community to exploit their data further once their proprietary periods have expired. There is already a wealth of fully public scienceready synoptic data from state-of-the-art instruments, which are accessible by standard data mining tools, waiting for analysis.

This paper is based on public time-domain data from the WFCAM Science Archive (WSA; Hambly et al. 2008). WF- CAM was designed to be capable of carrying out ambitious large-scale survey programs such as the UKIRT Infrared Deep Sky Surveys (UKIDSS; Lawrence et al. 2007). The detector consists of four arrays of 2048 × 2048 pixels, arranged in a noncontiguous square pattern, providing a resolution of 0.4^{′′} per pixel. A contiguous image with an areal coverage of 0.78 deg^2 can be constructed by a mosaic of four consecutive offset pointings. Other properties of the instrument are discussed in full detail by Casali et al. (2007). The standard UKIRT photometric system consists of the MKO J, H, and K bands (see Simons & Tokunaga 2002; Tokunaga et al. 2002) complemented with the Z and Y filters. In addition, three narrow-band filters (H_2, Brγ, and nb j) are also available (see Hewett et al. 2006 for further details).

All WFCAM data produced by the UKIDSS surveys and other smaller campaigns and PI projects employing the instrument are processed by the VISTA Data Flow System (VDFS; Emerson et al. 2004). VDFS was designed to initially handle UKIDSS, and includes both pipeline processing at the Cambridge Astronomical Survey Unit (CASU^1) and further pipeline processing of the CASU products and digital curation at the WSA. Data for standard photometric zero-point calibration of and color term determination for the WFCAM filters are taken regularly and are also fully processed and archived by the VDFS in the same way as the survey data. During the several years of operation of WFCAM, a large amount of fully processed, highquality, multiband photometric data have been collected during the observations of calibration fields, which are publicly available at the WSA. Since the majority of these fields have been visited several times over many years, these data provide an excellent opportunity for studying of variable stars in the NIR.

In this paper, we perform a comprehensive stellar variability analysis of the public WFCAM Calibration (WFCAMCAL) Database (release 08B) and present the photometric data and characteristics of the identified variable stars as the WFCAM Variable Star Catalog, version 1 (WVSC1). The paper is structured as follows. In Sect. 2, we present the database and its characteristics from a data miner’s point of view and describe the primary source selection procedure. In Sect. 3, we introduce and discuss a set of variability indices designed for synoptic data with correlated sampling, and we employ these indices as a first selection of candidate variable sources in the WFCAM data. We present a frequency analysis of the candidate variable sources in Sect. 4. In Sect. 5, we present the WVSC1 by describing its structure and discussing its variable star content. Finally, in Sect. 6, we draw our conclusions and discuss some future perspectives.

2. The WFCAMCAL database

WFCAM on-sky image data are pipeline-processed by the VDFS, which incorporates all data reduction steps from image processing to photometry. The various processing steps are described fully by Emerson et al. (2004), and accordingly we limit ourselves to discussing some key aspects. Individual exposures go through the standard preprocessing steps, such as flat fielding and dark subtraction. As is common practice in the NIR, science frames are composed of a set of dithered images, i.e. subsequent exposures taken in step patterns of several arcseconds, in order to allow for the removal of bad detector pixels and to image the structure of the atmospheric IR foreground for its subtraction before stacking the dither sequence. These so-called detector frame stacks are the final image products of calibration field observations, but we note that some WFCAM survey images are combined further to form contiguous mosaic images also known as tiles. Deep stack images are also produced, in order to push the limiting magnitudes and measure the fluxes of faint sources.

Further steps in the reduction include source extraction and aperture photometry using a set of small circular apertures with radii of 0.5, √ 2/2, 1, √ 2, and 2 arcseconds, in order to maximize the signal-to-noise ratio and remedy systematics due to source crowding (Cross et al. 2009). Flux loss in the wings of the point spread functions (PSF’s) is corrected for (Irwin et al. 2004). Each identified source of the catalogs is classified based on the shape of its PSF, and various quality flags are also assigned. Astrometric calibration is performed using 2MASS (Skrutskie et al. 2006) stars as reference, and positions have a typical accuracy of 0.1^{′′}. Magnitudes are corrected for distortion effects and are zero-point-calibrated on a frame-by-frame basis using a many of secondary standard stars from the 2MASS catalog (Skrutskie

1 http://casu.ast.cam.ac.uk/surveys-projects/wfcam/ technical/photometry

Article number, page 2 of 21

C. E. Ferreira Lopes^1 et al.: The WFCAM multiwavelength Variable Star Catalog

Fig. 1. Celestial distribution of our initial database of stellar sources from the WFCAMCAL08B archive.

et al. 2006). This involves colour corrections from the 2MASS JHKs to WFCAM ZY JHK. The calibration process is described in detail in (Hodgkin et al. 2009). Many calibration fields (which form the basis of this paper) are also observed repeatedly under photometric conditions, in order to provide standard star measurements for the calibrations of the Z, Y, and narrow-band magnitudes, as well as to provide data for the color-term determination for transforming of 2MASS magnitudes into the WFCAM photometric system. The accuracy of the magnitude zero-points of these fields is a few percent. We note that all magnitude data in the WSA and in our study alike are on the WFCAM magnitude system.

The calibrated source catalogs undergo further curation steps at the WSA, including quality control, source merging, and both internal and external cross-matching. Enhanced image products (e.g., deep stacks) are also created. Final science-ready data are ingested into a relational database, which offers various serverside data management tools. Data can be queried by using the Structured Query Language (SQL). The design of the WSA, the details of the data curation procedures and the layout of the database are described in great detail in Hambly et al. (2008) and Cross et al. (2009). In the following, we highlight some other properties of the data in the WFCAMCAL archive, with an emphasis on some important details for the time-series analysis.

2.1. Data characteristics

The WFCAMCAL archive’s data release 08B contains data from 52 individual pointings from both the northern and southern hemispheres, spread over nearly half of the sky. These calibration fields are located between declinations of +59^∘.62 and −24^∘.73, distributed over the full range in right ascension in order to provide standard star data year-round. The positions of the pointings are shown in Figure 1. Each pointing consists of a non-contiguous area covered by the four WFCAM chips, covering ∼ 0.05 square degrees each. The total area covered by all standard star fields is ∼ 10.4 square degrees.

The majority of the fields are observed repeatedly, with a rather irregular sampling. A field is usually visited at most a few times during a night, with the visits separated by up to a few hours. During each visit, the field is usually (but not necessarily) observed through the JHK or the ZY JHK filter set, and occasionally through the narrow-band filters as well, all within a few

Table 1. Morphological classification of sources in the WFCAMCAL archive

Class Description Number of sources −1 Star 318,995 −2 Probable star 33,188 +1 Galaxy 205,352 −3 Probable galaxy 2,345 0 Noise 10,377

Fig. 2. Spectral window of a typical well-sampled K-band light curve from the WFCAMCAL database, showing two different frequency ranges.

minutes. A certain field is usually observed again within a few days, although longer time gaps are common, and of course large seasonal gaps are also present in the data set. The total baseline of the time series is largely field-dependent and varies from a few months up to three years. The time sampling (cadence) in a single passband can be considered to be quasi-stochastic with rather irregular gaps, which is a favorable scenario for detecting of periodic signals over a wide range of periods. Figure 2 shows the spectral window of a typical one among the well-sampled K-band light curves in the database, showing that only one-day and one-year aliases are significant. However, the sampling in different passbands is very strongly correlated.

The VDFS performs an accurate and deep source extraction procedure on deep stack images, which, in the case of the WFCAMCAL database, is merged from the seven bestseeing frames to reduce any problems with blending (Cross et al. 2009). This curation step gives rise to database entities known as Sources. Positional cross-matches between these Sources and detections from different single detector frame stacks are then performed for each frame set (i.e., images with the same pointing). The prescriptions for this cross-matching procedure and its limitations are given by Hambly et al. (2008, see their Sect. 3.4.2). Each Source of the database contains only partial information from a set of source detections positionally matched with each other, but is related to a set of pointers that track all the attributes of the corresponding detections. We note that after cross-matching, the VDFS also recalibrates the individual epochs after comparison to the deep stack to improve the light curves. The resulting source-merged catalog is stored in WSA’s relational database, which in the case of WFCAMCAL data, follows a synoptic database model designed for observations with correlated sampling (Cross et al. 2009). Since the observations of

Article number, page 3 of 21

A&A proofs: manuscript no. ferreiralopes_aa_wfcam

Table 2. Number of sources, average total baseline (⟨T_{tot}⟩, in days), and average number of epochs ⟨N_{ep}⟩ in each filter, in our initial database.

Filter N ⟨T_{tot}⟩ ⟨N_{ep}⟩ Z 204,245 1033 51 Y 212,334 1061 56 J 212,717 1058 58 H 212,169 1074 61 K 201,645 1065 60 H_2 110,587 429 4 Brγ 130,307 258 2 nb j 68,048 120 3

the standard star fields through different filters are always taken within a time interval that is several orders of magnitude shorter than the interval between two successive observation batches (i.e., visits of the same field, see above), they can be considered to be virtually at the same epoch. Individual source detections in different filters for each epoch (i.e., filter sequence) are therefore merged and stored in a database entity called synoptic source, and these are linked to Sources (see above). Various metadata of the time series formed by the detections associated to each Source are also provided by WSA as the attributes of the variability table, providing the best aperture for a given source, together with basic statistics on the magnitude distribution, time sampling, etc. In passing we note that this table also provides a basic assessment on the probability that a source is variable in each band, based on the comparison of the rms scatter of the time series to its expected value from a simple noise model (see Cross et al. 2009). Although these pieces of information can provide useful guidance for the user, we opted not to use these attributes as criteria in our source selection, since our aim is to perform a more profound variability search in the data.

2.2. Initial source selection

Data were retrieved in a two-step procedure via WSA’s freeform SQL query facility.^2 We queried all Sources that were classified as a star or probable star based on the PSF statistics of the merged source, having at least ten unflagged epochs in either of the eight filter passbands.

Our selection resulted in an initial database of 216,722 sources containing their identifiers and general attributes such as positions, basic flux, and sampling statistics. Figure 3 shows histograms of the queried light curves and the average total baseline length as a function of the number of epochs, while Tables 1 and 2 summarize some basic statistics of the queried data. The sampling of the time domain is rather heterogeneous, thus we must emphasize that the WFCAMCAL archive should not be considered as a synoptic survey database, for its completeness is highly varying from field to field; accordingly, care must be taken with any statistical interpretation based on these data. However, there are a large number of light curves with very good sampling that have ∼ 100 data points in three to band broad-band filters, with a total baseline of up to 3 years. Since the number of data points in the narrow-band filters is generally very low, we do not use these measurements for the variability search, but they are provided (if available) for the detected variable sources in our catalog.

With the result of our first selection query at hand, we queried the complete light curves of each source by linking their entries in the Source table to the attributes of the Synoptic Source

2 http://surveys.roe.ac.uk:8080/wsa/SQL_form.jsp

Fig. 3. Histograms showing the number of sources (N_s) as a function of the number of epochs (N_{ep.}) for the queried J- (left) and Z-band (right) light curves with a bin size of 10 days. The distribution corresponding to the other broad bands are very similar. The solid curves show the average total baseline length as a function of the number of epochs for the queried light curves in the same filters with a bin width of 2 days.

table. This procedure requires the generation of a temporary SQL table provided by the user containing the identifiers of the Sources from the first query. We note that some data, such as Julian Dates and zero-point errors, are stored in different database objects like the Multiframe table, which require the execution of further table joins. We selected magnitudes with sufficiently small error bits (< 128), rejecting highly saturated measurements and data affected by various severe defects (e.g., bad pixels, poor flat-field region, detection close to frame boundary, etc.).

3. Broad selection by variability indices

A key characteristic of the time-series data in the WFCAMCAL database is that, owing to the observation strategy, their sampling is strongly correlated in the different filters (see Sect. 2.1). The characteristic time lag between data points in different filters in an observing sequence (i.e., a standard visit of a calibration field) is not longer than a few minutes, which is orders of magnitude shorter than the typical time gap between such batches of data and also than the time scales of stellar variability at amplitudes that are typically recoverable by the present sampling and accuracy. This property of the data enables us to search for stellar variability through correlations between the temporal flux changes at different wavelengths.

In our approach to stellar variability searching, we make the following general assumptions: (i) intrinsic stellar variability is typically identifiable in a wavelength range that is wider than our broad-band filters (i.e., in more than one filter); (ii) it is sufficiently phase-locked at two close wavelengths, thus flux variations in neighboring wavebands will be correlated; and (iii) nonintrinsic variations will be typically stochastic. In point (iii) we also implicitly assume that wavelength-correlated systematics of instrumental and atmospheric origin, or due to possible data reduction anomalies, have amplitudes that are small to be enough comparable to those provided by stochastic variations. The most important deviation from this assumption for our data is due to the temporal saturation of bright objects, which can, however, be easily distinguished from stellar variability.

Article number, page 4 of 21

A commonly used approach to identifing stellar variability through correlations in flux changes is by the Welch-Stetson index (I_{WS}; Welch & Stetson 1993; Stetson 1996). The idea behind this index is to separate stochastic variations from systematic trends by measuring the correlations in the deviations from the mean of data points that are located sufficiently close in time. It is defined as

I_{WS} = � 1 n(n − 1) n� i=1 (δb_iδv_i) , (1)

where

δb_i = b_i − b̄ σ_{b,i}

, δv_i = v_i − v̄ σ_{v,i}

, (2)

with b_i, v_i, and σ_{b,i}, σ_{v,i} denoting magnitudes and their errors (the latter computed following the prescriptions by Stetson 1981), respectively, taken on a time scale that is much shorter than that of the intrinsic stellar variations of interest. These magnitudes and errors can represent either successive monochromatic measurements or data points taken in two different filters. We also note that b̄, v̄ are weighted averages. Finally, n denotes the number of epochs, by which we also refer to the number of short time slots that contain subsequently taken measurements in the case of non-simultaneously observed data with strongly correlated sampling. The I_{WS} index is found to be significantly more sensitive than the “traditional” χ^2-test for single variance, which uses the magnitude-rms scatter distribution of the data as a predictor (see, e.g., Pojmanski 2002).

3.1. Extension of I_{WS} to multiband datasets

According to the definition given in Eq. (1), I_{WS} is limited to pairwise comparisons of fluxes. When it is applied its application to panchromatic data with measurements taken in several wavebands with correlated sampling, one would need to define some conversion of the pairwise indices into a single quantity. To accomplish this, we introduce the following modification to I_{WS}, for quantifying panchromatic flux correlations (pfc):

I^{(2)}_{pfc} = � (n_2 − 2)!

n_2! n� i=1 � � � � � m−1� j=1 � � � � m� k= j+1 � δu_{i j}δu_{ik} � � � � � � � � � � , (3)

where n is the number of epochs, m is the number of wavebands, u_{i j} are the flux measurements, δu_{i j} is defined by Eq. (2) for each filter, and n_2 = n · m!/[2!(m − 2)!]. We note that, for m = 2, I^{(2)}_{pfc} = I_{WS}.

While Eq. (2) still measures variability through pairwise correlations of relative fluxes, we can generalize it for quasisimultaneously measured batches of three data points (in case of m ≥ 3) by

I^{(3)}_{pfc} = � (n_3 − 3)!

n_3! n� i=1 � � � � � m−2� j=1 � � � � m−1�

k= j+1 � � � m� l=k+1

Λ^{(3)}_{i jkl} � �δu_{i j}δu_{ik}δu_{il} � � � � � � � � � � � � � � , (4) where n_3 = n · m!/[3!(m − 3)!], and the Λ factor is defined as

Λ^{(3)}_{i jkl} = � � � � � +1 if δu_{i j} > 0, δu_{ik} > 0, δu_{il} > 0 ; +1 if δu_{i j} < 0, δu_{ik} < 0, δu_{il} < 0 ; −1 otherwise. (5)

We note that we introduced Λ^{(3)} to give the proper sign to the product in Eq. (4).

Finally, in the case of quasi-simultaneously measured batches of s data points (for m ≥ s), our variability index takes the following general form:

I^{(s)}_{pfc} = � (n_s − s)!

n_s! n� i=1 � � � � m−(s−1)�

j_1=1

· · · � � � � m� j_s = j_{(s−1)}+1

Λ^{(s)}_{i j1··· js} � �δu_{i j1} · · · δu_{i js} � � � � � � � � � � , (6) where n_s = n · m!/[s!(m − s)!], and the Λ^{(s)} correction factor is

Λ^{(s)}_{i j1··· js} = � � � � � +1 if δu_{i j1} > 0, · · · , δu_{im} > 0 ; +1 if δu_{i j1} < 0, · · · , δu_{im} < 0 ; −1 otherwise. (7)

Clearly, these indices set increasingly strict constraints on the presence of variability with increasing order s.

3.2. An alternative variability index

While the I^{(s)}_{pfc} index is quite robust, in the sense that it is weighted with the individual errors, it can be insensitive to true variable stars for one or several substantially outlying data points when incorrect error estimates are present. Indeed, this index may even introduce false variability candidates if these outliers are correlated in two or more bands. Although such situations might seem rare, NIR data in particular can present us with these cases quite frequently, particularly in the case of bright stars. Since the sky foreground emitted by the atmosphere is highly variable in the NIR, it causes a highly time-varying saturation limit, which can affect large parts of otherwise highly accurate time-series data for bright stars with substantial outliers having very small formal error estimates. In case of correlated sampling, these outliers will probably be correlated between different filters, leading to a spurious impact upon the I^{(s)}_{pfc} index.

To alleviate the effect of such anomalous outliers, we introduce an alternative variability index that is similar to I^{(s)}_{pfc}, but does not depend on the actual value of the flux deviations from the mean. This is simply obtained by keeping only the Λ function (Eq. 7) in the sum that appears in Eq. (6). Thus, the fluxindependent (fi) version of I^{(2)}_{pfc} is defined as

2 · I^{(2)}_fi − 1 = 1 n_2 n� i=1 � � � � m−1� j=1 � � � � m� k= j+1

Λ^{(2)}_{i jk} � � � � � � � � , (8)

with Λ^{(2)}_{i jk} defined as

Λ^{(2)}_{i jk} = � � � � � +1 if δu_{i j} > 0, δu_{ik} > 0 ; +1 if δu_{i j} < 0, δu_{ik} < 0 ; −1 otherwise. (9) Article number, page 5 of 21

In this expression, the δu’s have the same meaning as before (e.g., Eq. 4).

The righthand side of Eq. (8) thus gives the difference between the number of positive and negative terms in I^{(s)}_{pfc}, so it can only take a number of discrete values (depending on the values of n and m). We note that, with the coefficients included on the lefthand side of Eq. (8), I^{(2)}_fi will always have absolute values between 0 and 1, analogously to a probability measure.

For higher orders s, I^{(s)}_fi is defined similarly to Eq. (6):

2 · I^{(s)}_fi − 1 = 1 n_s n� i=1 � � � � m−(s−1)�

j_1=1

· · · � � � � m� j_s = j_{(s−1)+1}

Λ^{(s)}_{i j1··· js} � � � � � � � � , (10)

with 0 ≤ I^{(s)}_fi ≤ +1, and where Λ^{(s)}_{i j1··· js} is defined as in Eq. (7).

Thus, the index I^{(s)}_fi represents a problem of combining signals whose function Λ^{(s)}_{i j1··· js} (Eq. 7) assumes the values +1 or −1, depending on the sign of the correlation. The total number of possible combinations of signals in a set of s measurements, so that each group of signals is different from the other, is given by

A_s = s^2. (11)

For the index I^{(2)}_fi , for instance, we have four possible configurations, namely (++, +−, −+, −−). According to elementary probability theory, in the case of statistically independent events, the probability that a given event will occur is obtained by dividing the number of events of the given type by the total number of possible events. For the I^{(s)}_fi index of any order, the desired events will be those in which all signals are either positive or negative, so that, irrespective of the value of s, the number of events desired always equals two, and the number of possible events is given by Eq.( 11). In this way, the general expression that determines the probability value of a random event leading to a positive I^{(s)}_fi index is given by

P_s = 2 s^2

, (12)

given that there are s^2 events in total, but only two produce a positive I^{(s)}_fi value.

3.3. Numerical tests

To establish robust criteria for selecting of variable star candidates, we evaluated the responses of the I^{(s)}_{pfc} and I^{(s)}_fi indices to statistical fluctuations. We generated a large number of test timeseries sequences by shuffling the times (“bootstrapping”) of the WFCAMCAL data proper. By following this approach, we are able to keep part of the correlated nature of the noise intrinsic to the data, as opposed to numerical tests based on pure Gaussian noise. Figure 4 shows the histogram of the number of test time-series sequences as a function of the n_s number of terms appearing in the variability indices (see Eqs. 6, 10) for various s values. In total, 200,000 realizations were performed to our tests.

Figure 5 shows the distribution of the variability indices as a function of the average apparent brightness of the sources for both the bootstrapped and the corresponding original data. The excess of high values for bright sources, which is particularly evident for s = 2, is due to temporal saturation, which usually

Fig. 4. Histograms showing the number of combinations n_s in the simulations described in the text. Since the I^{(s)}_fi index is computed in a manner similar to that used to compute the I^{(s)}_{pfc} index, the number of combinations used is the same for both.

happens in more than one waveband at the same time. In this bright regime, as expected (Sect. 3.2), saturation affects the I^{(s)}_{pfc}

index much more frequently than it does I^{(s)}_fi . At the faint end, however, a number of effects can also be recognized. First, the quantized nature of the I^{(s)}_fi index (as opposed to the I^{(s)}_{pfc} index; see Sect. 3) becomes pronounced in the distribution, owing to the higher relative frequency of sources with but a few epochs (typically n_s ≲ 20) among the faint stars. (These are often not detected if the atmospheric foreground flux is too high.) Second, there is also an excess of sources with high index values at the faint end, which is due to the much lesser amount of data for these fainter sources, which makes the variability indices more sensitive to statistical fluctuations and systematics. The general trend in the distributions of the I^{(s)}_{pfc} and I^{(s)}_fi are also rather different. Because it is sensitive only to the consistency in the direction of the flux changes, the I^{(s)}_fi is equally responsive to contaminating systematics of different amplitudes. This is reflected by both the slight increase in the main locus of the distribution of this index as a function of magnitude toward the bright end (see Fig. 5, lower panels) and the enhanced (false) response in the faint end, as discussed earlier. These are both caused by the increasing dominance of correlated noise over photon noise. We note that this is not shown by the bootstrapped data at the bright end, since the points of distinct pawprint batches were shuffled, and thus the correlations between them were mostly lost, while

Article number, page 6 of 21

Fig. 5. Variability indices versus the K-band magnitude, for the simulations (top two rows) and the actual data (bottom two rows), for three values of s, namely 2 (left), 3 (middle), and 4 (right).

this is alleviated by the small number of points per light curve at the faint end.

Also noteworthy is that the simulated I^{(s)}_fi distributions that are shown in Figure 5 are centered on the theoretically expected values (see Sect. 3), as given by Eq. (12), namely 0.5 in the case of s = 2, 0.25 in the case of s = 3, and 0.125 for s = 4. Moreover, the simulation results for the I^{(s)}_{pfc} index show that the higher the

order of the index, the lower the dispersion around I^{(s)}_{pfc} = 0; however, a pronounced level of scatter remains at both the bright and faint ends of the distribution. In addition, there is a symmetry between scatterings for the index I^{(2)}_{pfc} and asymmetric scattering for I^{(3)}_{pfc} and I^{(4)}_{pfc}, both of which primarily scatter toward negative values, particularly at the bright end. This happens because the number of possible configurations of signs that lead to a Λ = +1 (Eq. 7) is always equal to two, whereas the number of possible configurations that lead to a Λ = −1 is instead given by s^2 − 2. In this way, for s = 2, we have a symmetrical distribution of configurations of signs, whereas for s > 2 the asymmetry in relation to negative values grows as s^2 − 2, as seen in the actual simulations.

We estimated the significance levels of our variability indices based on their cumulative number density distributions obtained from our bootstrapped data set. In other words, we used our boot-

Article number, page 7 of 21

Fig. 6. As in Figure 5, but for the cutoff surfaces used to select our target list, and also adding n_s as an independent variable. These surfaces set apart, at the 0.5% significance level, instances that are compatible with random noise (low values of the indices) from those that are compatible with coherent signal being present in the different passbands (high values of the indices).

strap simulations to set the signals apart that are compatible with pure random noise from the signals that indicate correlated variability in the different bandpasses. We expect these estimates to be highly dependent on the number of epochs n and the brightness (see above); accordingly, we obtained separate estimates for data within narrow ranges of n and K-band average magnitude, with values in between being obtained by interpolation. Figure 6 shows the result. In this figure, we show surfaces, in (index, n_s, K) space that set random noise apart from correlated signals at the 0.5% significance level, according to our two variability indices, namely I^{(s)}_{pfc} (top row) and I^{(s)}_fi (bottom row). As can be seen from Figure 6, the corresponding cutoff values of the I^{(s)}_fi variability index show a relatively weak dependence on the magnitude and a strong dependence on n_s, whereas the I^{(s)}_{pfc} index depends strongly on both of these quantities. This is mainly attributed to the fact that the mean values of the formal errors (estimated from photon noise only), to which I^{(s)}_{pfc} is very sensitive, increasingly underestimate the global scatter of the light curves toward lower magnitudes in this dataset.

3.4. Initial selection of variable star candidates

We next computed the variability indices introduced in Sect. 3 for all sources in our initial database. As many as 99.3% of these sources had quasi-simultaneous observations in at least two filters, while 91.3% and 81.3% of them were observed in at least three and four filters, respectively. For each variability index, we selected all sources above its empirical, sampling, and magnitude-dependent 0.5% significance level described in Sect. 3.3. We considered a source as a candidate variable star if either value of its variability indices was significant. This procedure resulted in our initial catalog of 6651 candidate variable stars.

4. Frequency analysis

There are many methods available for computing periods in unevenly spaced time-series data, based mainly on Fourier analysis, information theory, and statistical techniques, among others (see, e.g., Templeton 2004, for a review). Some of these methods are based on the fact that the phase diagram of the light curve (also known as simply “phased light curve”) is smoothest when it is visualized using its real period. They transform the set of data by folding within the phase interval 0 ≤ φ(i) < 1, which is defined by the following expression:

φ(i) = t(i) − t_0 P − INT � t(i) − t_0 P � , (13)

where t is the time, t_0 is the time origin, P is a test period, and INT denotes the integer function. Because of the presence of observational gaps, it often happens that computed phases can

Article number, page 8 of 21 have the same numerical values for several different test periods. Many periods are spurious because they correspond to gaps that may be present in the data (e.g., daytime, seasons, etc.; Lafler & Kinman 1965). If P is the true period and P_{gaps} the period of gaps (Damerdji et al. 2007), spurious periods are given by

P^{−1}_{spur} = P^{−1} ± k P^{−1}_{gaps}, (14)

where k ∈ N. In some cases, a spurious period could be ranked as the best period.

We searched for periodic variable stars in our initial catalog (see Sect. 3.4) by applying various frequency analysis methods in combination. To search for the best period (or, equivalently, frequency), many methods require that a search range (given by limiting frequencies f_0 and f_N at the low- and high-frequency ends, respectively) and resolution Δ f be specified first. Since we are dealing with data sets with various different time spans, we adapted the f_0 low-frequency limits to each light curve by f_0 = 0.5/T_{tot}, where T_{tot} is the total baseline of the observations, and we scaled the Δ f frequency resolution bas Δ f = 0.1/T_{tot}. The method described by Eyer & Bartholdi (1999) was used to determine the high-frequency limit f_N .

Initially, we applied the string-length minimization (SLM; Lafler & Kinman 1965; Stetson 1996) method on the light curves in our initial catalog of candidate variable stars. In this method, the period is found by minimizing the sum of the lengths of the segments joining adjacent points in the phase diagrams (called the “string lengths”) using a series of trial periods, i.e.:

Φ = �_{N−1i=1}

w_{i,i+1} |m_{i+1} + m_i| �_{N−1i=1}

w_{i,i+1}

, (15)

where

w_{i,i+1} = 1 � σ^2_{i+1} + σ^2_i � (φ_{i+1} − φ_i + ϵ)

, (16)

and φ_i, m_i, and σ_i are phases, magnitudes, and corresponding magnitude uncertainties, respectively, sorted in order of increasing phase according to the trial period. The variable ϵ is a term that is added to reduce the weight of very closely spaced data in phase space, which otherwise could have a weight approaching infinity (Stetson 1996). In our work, we assumed ϵ = 1/N, again following Stetson (1996).

To increase the probability that among the higher peaks of the periodogram derived on the basis of the SLM method the best period is included, we took the following additional steps:

– The SLM periodogram was independently computed for each broadband filter (Y, Z, J, H, and K), based on which all periods that presented a power greater than the 3σ level every band were selected;

– The SLM periodogram was also computed for the chromatic light curve, comprised of the sum of all broadband filters, and again all periods above the 3σ level were selected;

– The results of the previous two steps were then combined, yielding the best periods (i.e., the ones with the highest amplitude peaks) from both types of analysis.

These steps are very important, because the same source can have photometry of high quality in some filters, but not others.

In the second step of the period search, we applied three additional frequency analysis methods, to select the ten best among the periods selected by the SLM method. For this step, we used the “classical” Lomb-Scargle (LS) periodogram (Lomb 1976; Scargle 1982), the generalized Lomb-Scargle (GLS) periodogram (Zechmeister & Külrster 2009), and the phase dispersion minimization (PDM; Stellingwerf 1978) methods. We included both LS and GLS because the latter gives unbiased estimates of the standard deviation of the measurements only when the photometric errors are good, easily leading to spurious results otherwise. The PDM method was included due to its high sensitivity to highly non-sinusoidal variations with alternating peaks, as in the case of the light curves of eclipsing binary systems.

We proceeded with our analysis as follows:

– For all light curves that were preselected by the SLM method, we independently computed the periodogram using each of these methods and for each filter separately;

– After inverting the spectra from the PDM and SLM methods, the periodograms for each filter were then normalized by the maximum power;

– A single, normalized power spectrum was then obtained for each method by averaging over all filters the results obtained in the previous step for each filter independently;

– Finally, we obtained a ranked list of the best periods for each method.

The best periods should in principle be those that ranked highest in all four methods. However, not all methods rank periods in the same way. Therefore, to choose of periods in a more objective fashion, we computed a “super rank” index as the sum of the ranks provided by each of these five methods. We then selected the ten best periods as those ten most highly ranked, according to this new index.

Finally, in order to select the very best period, we use the χ^2 test, in which Fourier coefficients (a_0, a_i, b_i) are derived that fit the data according to the following expression:

f (i) = a_0 + n� i=1 � a_i sin � 2kπφ(i) � + b_i cos � 2kπφ(i) � , (17)

where k = 1/P. We used the Levenberg-Marquardt (Levenberg 1944; Marquardt 1963) method to find the solutions and employed the statistical F-test to evaluate the results. We limited the amplitude of the fit to the observed magnitude range (m_{max} − m_{min}) and kept the number of harmonics to n ≤ 20. The period that produced the lowest reduced χ^2 value was selected as the true main period. Finally, we visually inspected of the phase diagrams, which narrowed down our selection to our final catalog containing 275 periodic variable stars, as described in more detail in the next section.

5. Results and discussions

5.1. Catalog of periodic variable stars (C1)

Proceeding as described in the previous section, we have thus obtained our final sample of 275 clearly periodic variable stars (C1). Their coordinates, periods, mean magnitudes, and the number of epochs in each filter are listed in Table 5. We also provide preliminary classifications for most of the newly discovered variables. The variability types of these sources were assigned by visual inspection of their phase diagrams, and are also listed in

Article number, page 9 of 21

Fig. 7. Phase-folded light curves of selected objects from our catalog of periodic variables (C1), showing data in all five broadband filters of WFCAM. ID’s, types, and periods for each object are shown in the headers. The object WVSC-208 was only detected in the Z and Y bands.

Article number, page 10 of 21

Fig. 8. Distribution of I_fi versus I_{pfc} variability indices, for orders 2 (left) and 3 (right). The C1 and C2 sources are indicated by red and green circles, respectively.

Table 5, using the nomenclature of the General Catalog of Variable Stars^3 (GCVS, Samus 1977). Phase-folded light curves for some of these objects are shown in Figure 7.

5.2. Catalog of aperiodic variable stars (C2)

We also searched for those stars that, in spite of showing reasonably coherent light curves, do not show a clear main periodicity in the WFCAMCAL data, either because their variations are intrinsically aperiodic or because they have such long periods that these data were insufficient for deriving them. To identify such sources, we relied only on the variability indices, requiring that these have highly significant values, indicating the presence of correlated variations in the different WFCAM bandpasses. First, we selected sources by using a strong cutoff at the samplingand magnitude-dependent 0.1% significance level, equivalently to the procedure described in Sect. 3.4. Table 3 shows the number of selected sources based on each of the cutoff surfaces shown in Figure 5, before and after visual inspection. The number of sources selected by the I^{(s)}_fi index is less than a third of the sources selected using the I^{(s)}_{pfc} index, and at the same time, it includes 80% of all sources in C1 (Sect. 5.1). This high efficiency at a relatively low false alarm rate favored the application of the I^{(s)}_fi index alone for selecting aperiodic variable candidates, which was followed by a visual inspection in order to reject likely false candidates.

Our procedure has led to an additional 44 sources, comprising our catalog of semi-regular or aperiodic variable stars and stars with uncertain periods (C2), shown in Table 6. The selected variable star candidates, including both periodic (C1) and non-periodic (C2) sources, are shown in the [I^{(s)}_fi , I^{(s)}_{pfc}] plane (for

s = 2 and 3) in Figure 8. This figure clearly shows that the I^{(s)}_fi index is significantly more powerful, as far as distinguishing the variability in the WFCAM data is concerned, compared with the I^{(s)}_{pfc} index, since there is much less overlap between variable and non-variable sources in the former than the latter. As a word of

3 A full description of the nomenclature can be found at http://www. sai.msu.su/gcvs/gcvs/iii/vartype.txt caution, we note that the C2 catalog could still contain spurious sources, mainly due to sources that show correlated seasonal variations and/or correlated noise variations. Follow-up studies of these sources is thus strongly recommended, before conclusively establishing their variability status.

Table 3. Number of variable star candidates selected by the different variability indices at different significance levels before and after (in parentheses) visual inspection.

Sign. level I^{(2)}_{pfc} I^{(3)}_{pfc} I^{(2)}_fi I^{(3)}_fi 0.5% 4598(219) 3574(192) 1292(242) 1045(242) 0.1% 1676(145) 1337(141) 466(186) 398(190)

5.3. Cross-identifications

As the final step in our analysis, we performed a systematic cross-check of the sample of 319 sources in C1 and C2 catalogs to identify previously known sources and complement our catalog with data already in the literature. Among the cross-checked catalogs, one finds the SIMBAD database, the latest version of the General Catalog of Variable Stars (Samus et al. 2012), the AAVSO International Variable Star Index (VSX v1.1, now including 284,893 variable stars; Watson et al. 2014), the New Catalog of Suspected Variable Stars (Kazarovets et al. 1998), and the Northern Sky Variability Survey (NSVS; Hoffman et al. 2009) catalog, among many other databases incorporated in the International Virtual Observatory Alliance (IVOA), using the Astrogrid facility^4.

A delicate issue that we face when performing these extensive cross-checks between surveys with such diverse technical properties is their different astrometric accuracy. In this sense, we assumed a positional accuracy of 2^{′′} in the sky coordinates for WFCAM, and then used optimized search radii according to the specific nature of each cross-matched database.

Taking the distribution of our sources across the sky into account, along with the specific nature of the observations that

4 http://www.astrogrid.org/

Article number, page 11 of 21

Fig. 9. Color-color (on left panel) and color-magnitude (right panel) diagrams of the analyzed sample. New objects in C1 (in blue) and C2 (in red) and previously known objects (in green) are shown with colored points. Red arrows indicate the reddening vectors.

comprise the WFCAMCAL catalog, which were aimed at observing standard star fields and hence tended to avoid very crowded regions, it did not come as a surprise that the crosschecking with variability surveys of the southern sky and Galactic central regions, such as OGLE, MACHO, and ASAS, did not result in any positive match. We extended the search further to other astronomical catalogs of non stellar and/or extragalactic objects (e.g., planetary nebulae, quasars, optical counterparts of GRBs, just to mention a few) and in different spectral bands (from radio to X-rays), but again finding no superpositions with our WFCAM sources.

At the end of this search, we found a total of 44 stars that were already known from previous studies. Among them, 37 sources are included in the VSX catalog, three of which are also GCVS objects (i.e., AM Tau, EH Lyn, UV Vir, which are an Algol-type eclipsing binary, a contact binary, and an ab-type RR Lyrae, respectively). The GCVS also lists five other eclipsing binaries and another RRab Lyrae (HM Vir).

The outer part of the globular cluster M3 (NGC 5272) is also partly covered by the WFCAMCAL pointings. Indeed, among our preselected variable candidates, we were able to recover 11 stars that had already been identified as RR Lyrae stars by Cacciari et al. (2005), Jurcsik et al. (2012), and Watson et al. (2014). Cross-identifications and literature variability types of the previously known sources are given for C1 and C2 in Tables 4 and 6, respectively.

5.4. Detection efficiency

To estimate the variable star detection efficiency of our method, we determined whether any variable stars in the WFCAM calibration fields that are known from other catalogs were not detected by us. Similar to the procedure described in Sect. 5.3, we performed positional cross-matches of our initial database of 216,722 light curves with all existing survey catalogs of variable stars incorporated in the IVOA. We found a total of 15 known variables (all of them periodic) that were missed by our search. Thirteen of them were excluded in the first broad selection phase (see Sect. 3) owing to the low values of their variability indices. The properties of these stars are listed in Table 8, and their WF- CAM photometry is added to our catalog of periodic variable stars (C1), including a flag that refers to their non-detection as variables by our analysis.

Fig. 10. Example light curves of 4 previously known variable stars that were not detected in our analysis. ID’s, variability types, and periods for each star are shown in the headers.

Figure 10 shows four typical examples among the nondetected variables. The non-detection of these sources is either due to the insufficient phase coverage of their magnitude variations by WFCAM data (primarily in the cases of long-periodic eclipsing binaries with very low fractional transit lengths, see Fig. 10, upper panels) or due to saturation (Fig. 10, lower left panel) or to a very low signal-to-noise ratio.

Since the heterogeneity and small number of objects known from other variable star catalogs overlap with the WFCAMCAL fields make them insufficient for a quantitative assessment of our

Article number, page 12 of 21

Fig. 11. Detection efficiency E_{det.} vs K mean magnitude for 10^5 synthetic variables.

detection efficiency, we performed further tests using synthetic data. To do this we first built a database of noise-free LCs as being harmonic fits (see Eq. 17) of actual C1 data, in each filter. Next, we generated 10^5 synthetic light curves, following the distributions of periods, amplitudes, and sampling of the final C1 catalog. Then, these synthetic light curves were added to segments of the real light curves of non-variable stars from the WF- CAMCAL database. Finally, we applied the same procedures of variability search and period analysis that we discussed in Sections 3 and 4 on the simulated data.

The result of our test is summarized by Figure 11, which shows the detection efficiency E_{det.} = N_{det.}/N_{all} as a function of K magnitude using bins of 0.25 mag, where N_{det.} is the number of detected variables, and N_{all} is the number of all variables, respectively. Based on this test, we estimate an average detection efficiency of 93% over the complete magnitude range of the WFCAM database. Detection rates lower than 90% are only present in the two extremes of the magnitude range, dominated by saturation in the bright end and low signal-to-noise ratio in the faint end. We note that the lower overall detection efficiency suggested by the catalog cross-matches is due to the biased magnitude distribution of the cross-matched sources toward the bright end of the WFCAM magnitude range.

5.5. Photometric properties of the variables

Figure 9 shows the variable and non-variable sources on the (H −K)−(J −H) color-color and the K −(J −K) color-magnitude planes. The variable sources cover the entire range of stellar parameter space in these planes. It is also clear from this figure that the area covered by the WFCAM Calibration fields have significant differential reddening, and a great fraction of the variables are reddened sources. This, together with the large aperture of the UKIRT telescope, explains the relatively low number of cross-identifications with previously known objects (Sect. 5.3): the WFCAMCAL database covers a range of faint NIR magnitudes where most of the optical variability surveys cannot penetrate, while most of the known variables in those catalogs are too bright for WFCAM.

We found 32 highly reddened (Z − K > 3) variable sources, 17 of which are periodic. We found that the positions of these red sources are strongly clustered around the positions α = 18^h29.5^m, δ = +1^∘36^′ (25 sources), and α = 7^h0^m, δ = −4^∘51^′ (8 sources). They are surrounded by a number of dark nebulae previously cataloged by Dobashi (2011) and Dutra & Bica (2002), respectively, suggesting that these sources might be embedded young stellar objects (see Tables 4, 6).

6. Conclusions

In this paper, we have established the WFCAM Variable Star Catalog, based on a detailed analysis of the WFCAMCAL NIR database. Our catalog contains 319 variable point sources, among which are 275 that are clearly periodic, and it includes 44 previously known objects. All catalog entries including multiband light curve data are available online via the WFCAM Science Archive (WSA)^5. Our approach to variability analysis included introducing a new, flux-independent variability index that is highly insensitive to the presence of outliers in the time-series data. A cross-matching procedure with previous variable star catalogs was also carried out, and the few sources with previous identification in the literature are noted. These catalogs represent one of the first such resource in the NIR, and thus an important first step toward the interpretation of future, more extensive NIR variability datasets, such as will be provided by the Vista Variables in the Vía Láctea (VVV) Survey in particular (Catelan et al. 2013). A more detailed analysis of the different classes of variable stars detected in our catalog will be presented in a forthcoming paper.

Acknowledgements. Research activities of the Observational Astronomy Stellar Board of the Universidade Federal do Rio Grande do Norte are supported by continuous grants from the CNPq and FAPERN Brazilian agencies. We also acknowledge financial support from INCT INEspaco/CNPq/MCT. CEFL acknowledges a CAPES graduate fellowship and a CNPq/INEspaço postoctoral fellowship. Support for C.E.F.L., M.C., and I.D. is provided by the Chilean Ministry for the Economy, Development, and Tourism’s Programa Inicativa Científica Milenio through grant IC 12009, awarded to The Millennium Institute of Astrophysics (MAS); by Proyectos FONDECYT Regulares #1110326 and 1141141; by Proyecto Basal PFB-06/2007; and by Proyecto Anillo de Investigación en Ciencia y Tecnología PIA CONICYT-ACT 86. R.A. acknowledges support of Proyecto GEMINI-CONICYT #32100022, of a PUC School of Engineering Postodoctoral Fellowship. Additional support by project VRI-PUC 25/2011 is also gratefully acknowledged. ICL acknowledges a CNPq/PNPD postdoctral fellowship.

References

Alcock, C., Allsman, R. A., Axelrod, T. S., et al. 1993, Sky Surveys. Protostars to Protogalaxies, 43, 291 Arnaboldi, M., Neeser, M. J., Parker, L. C., et al. 2007, The Messenger, 127, 28 Arnaboldi, M., Rejkuba, M., Retzlaff, J., et al. 2012, The Messenger, 149, 7 Bakos, G., Noyes, R. W., Kovács, G., et al. 2004, PASP, 116, 266 Blažko, S. 1907, Astron. Nachr., 175, 325 Blomme, J., Sarro, L. M., O’Donovan, F. T., et al. 2011, MNRAS, 418, 96 Cacciari, C., Corwin, T. M., & Carney, B. W. 2005, AJ, 129, 267 Casali, M., Adamson, A., Alves de Oliveira, C., et al. 2007, A&A, 467, 777 Catelan, M., Minniti, D., Lucas, P. W., et al. 2013, in 40 Years of Variable Stars: A Celebration of Contributions by Horace A. Smith, p. 139 (arXiv:1310.1996) Cincotta, P. M., Mendez, M., & Nunez, J. A. 1995, ApJ, 449, 231 Clausen, J. V., Torres, G., Bruntt, H., et al. 2008, A&A, 487, 1095 Cross, N. J. G., Collins, R. S., Hambly, N. C., et al. 2009, MNRAS, 399, 1730 Dalton, G. B., Caldwell, M., Ward, A. K., et al. 2006, Proc. SPIE, 6269, 62690X- 1 Damerdji, Y., Klotz, A., & Boër, M. 2007, AJ, 133, 1470 Deeming, T. J. 1975, Ap&SS, 36, 137 Distefano, E., Lanzafame, A. C., Lanza, A. F., et al. 2012, MNRAS, 421, 2774 Dobashi, K. 2011, PASJ, 63, 1 Drake, A. J., Djorgovski, S. G., Mahabal, A., et al. 2009, ApJ, 696, 870 Dutra, C. M., & Bica, E. 2002, A&A, 383, 631 Dworetsky, M. M. 1983, MNRAS, 203, 917 Emerson, J. P., Irwin, M. J., Lewis, J., et al. 2004, Proc. SPIE, 5493, 401

5 http://surveys.roe.ac.uk/wsa/

Article number, page 13 of 21

A&A proofs: manuscript no. ferreiralopes_aa_wfcam

Eyer, L. 2006, Astrophysics of Variable Stars, 349, 15 Eyer, L., & Bartholdi, P. 1999, A&AS, 135, 1 Fruth, T., Kabath, P., Cabrera, J., et al. 2012, AJ, 143, 140 Hambly, N. C., Collins, R. S., Cross, N. J. G., et al. 2008, MNRAS, 384, 637 Handler, G. 2012, preprint (arXiv:1205.6407) Hewett, P. C., Warren, S. J., Leggett, S. K., & Hodgkin, S. T. 2006, MNRAS, 367, 454 Hoffman, D. I., Harrison, T. E., & McNamara, B. J. 2009, AJ, 138, 466 Hodgkin, S. T., Irwin, M. J., Hewett, P. C. 2009, MNRAS, 394, 675 Irwin, M. J., Lewis, J., Hodgkin, S., et al. 2004, Proc. SPIE, 5493, 411 Jurcsik, J., Hajdu, G., Szeidl, B., et al. 2012, MNRAS, 419, 2173 Kaiser, N., Aussel, H., Burke, B. E., et al. 2002, Proc. SPIE, 4836, 154 Kazarovets, E. V., Samus, N. N., & Durlevich, O. V. 1998, IBVS, 4655, 1 Krabbendam, V. L., & Sweeney, D. 2010, Proc. SPIE, 7733 Lafler, J., & Kinman, T. D. 1965, ApJS, 11, 216 Levenberg, K. 1944, Quarterly of Applied Mathematics, 2, 164 Lomb, N. R. 1976, Ap&SS, 39, 447 Law, N. M., Kulkarni, S., Ofek, E., et al. 2009, Bulletin of the American Astronomical Society, 41, #469.01 Lawrence, A., Warren, S. J., Almaini, O., et al. 2007, MNRAS, 379, 1599 Marquardt, D. W. 1963, SIAM Journal of Applied Mathematics, 11, 431 McCommas, L. P., Yoachim, P., Williams, B. F., et al. 2009, AJ, 137, 4707 Minniti, D., Lucas, P. W., Emerson, J. P., et al. 2010, New A, 15, 433 Perryman, M. A. C. 2005, Astrometry in the Age of the Next Generation of Large Telescopes, 338, 3 Pojmanski, G. 2002, Acta Astron., 52, 397 Pollacco, D. L., Skillen, I., Collier Cameron, A., et al. 2006, PASP, 118, 1407 Riello, M., & Irwin, M. 2008, 2007 ESO Instrument Calibration Workshop, 581 Riess, A. G., Filippenko, A. V., Challis, P., et al. 1998, AJ, 116, 1009 Samus N. N., Durlevich O. V., Kazarovets, E. V., et al. 2012, General Catalog of Variable Stars, VizieR On-line Data Catalog: B/gcvs Samus, N. N., Durlevich, O. V., & Kazarovets, R. V. 1997, Baltic Astronomy, 6, 296 Scargle, J. D. 1982, ApJ, 263, 835 Shin, M.-S., Yi, H., Kim, D.-W., Chang, S.-W., & Byun, Y.-I. 2012, AJ, 143, 65 Siegel, M. H., & Majewski, S. R. 2000, AJ, 120, 284 Simons, D. A., & Tokunaga, A. 2002, PASP, 114, 169 Skrutskie, M. F., Cutri, R. M., Stiening, R., et al. 2006, AJ, 131, 1163 Stellingwerf, R. F. 1978, ApJ, 224, 953 Stetson, P. B. 1981, AJ, 86, 1500 Stetson, P. B. 1996, PASP, 108, 851 Templeton, M. 2004, JAAVSO, 32, 41 Tokunaga, A. T., Simons, D. A., & Vacca, W. D. 2002, PASP, 114, 180 Tonry, J. L., Schmidt, B. P., Barris, B., et al. 2003, ApJ, 594, 1 Udalski, A. 2003, AcA, 53, 291 Walker, A. R. 2012, Ap&SS, 341, 43 Watson, C., Henden, A. A., & Price, A. 2014, VizieR Online Data Catalog, 1, 2027 Welch, D. L., & Stetson, P. B. 1993, AJ, 105, 1813 Zechmeister, M. & Külrster, M. 2009, A&A, 496, 577

Article number, page 14 of 21

Table 4. Periodic objects in the WFCAM Variable Star Catalog (C1)

ID [WSA] ID [WVSC] ID RA [deg.] DEC [deg.] type P [d] ⟨Z⟩ ⟨Y⟩ ⟨J⟩ ⟨H⟩ ⟨K⟩ N_Z N_Y N_J N_H N_K 858993461311 WVSC-001 UNC 146.283535 59.539435 UNC 0.158027 16.884 16.623 16.192 15.723 15.550 10 10 18 16 16 858993464444 WVSC-002 UNC 145.560146 59.046595 RR 0.49192 16.936 16.912 16.697 16.516 16.579 10 9 19 16 17 858993475542 WVSC-003 CSS_J033147.8+374651 52.949484 37.780864 EW 0.247579 15.796 15.522 15.013 14.385 14.188 59 79 91 84 93 858993476434 WVSC-004 CSS_J033109.1+375343 52.788116 37.895692 EW 0.286644 16.611 16.350 15.911 15.345 15.163 57 76 87 79 84 858993477934 WVSC-005 UNC 53.345266 37.87284 UNC 0.127022 18.874 18.470 17.814 17.199 16.974 54 72 81 73 77 858993478382 WVSC-006 UNC 53.424094 37.81507 UNC 2.4277 16.261 15.907 15.326 14.636 14.346 60 78 87 82 90 858993479072 WVSC-007 UNC 53.53775 37.853985 EB? 1.7298 18.447 18.008 17.327 16.652 16.370 55 74 83 75 81 858993484033 WVSC-008 UNC 9.491549 37.781801 MP? 10.205 16.733 16.561 16.078 15.633 15.412 99 102 115 114 117 858993534207 WVSC-009 CSS_J033354.2+372322 53.476152 37.389687 EW 0.262090 15.289 14.744 14.181 13.406 13.109 58 79 92 85 94 858993535184 WVSC-010 CSS_J033319.1+371524 53.329849 37.256611 EW 0.299889 15.839 15.608 15.242 14.803 14.572 57 78 91 84 93 858993539168 WVSC-011 UNC 52.912129 37.39636 EB 0.295638 19.236 18.798 18.249 17.572 17.440 45 65 77 70 72 858993544979 WVSC-012 UNC 9.541155 37.206287 LP? 12.578 15.318 15.096 14.708 14.182 14.047 99 102 115 115 118 858993546108 WVSC-013 UNC 9.151256 37.293481 EB/EW 0.400364 11.733 11.672 11.467 11.251 11.192 90 94 115 110 119 858993549466 WVSC-014 NSVS 7772290 224.808071 37.042755 RRab 0.63019 14.143 14.092 13.899 13.697 13.609 77 5 107 101 114 858993598145 WVSC-015 LINEAR 19154958 250.150045 36.819243 EA 0.506418 13.647 13.490 13.109 12.633 12.509 68 73 84 76 83 858993603097 WVSC-016 UNC 250.399529 36.464598 WV 1.22670 15.774 15.733 15.429 14.794 14.726 4 3 17 15 38 858993615087 WVSC-017 LINEAR 18385620 +246.5010500 +34.8893750 DSCT 0.056949 15.620 15.637 15.456 15.410 15.401 55 62 65 63 65 858993625957 WVSC-018 V1183 Her 247.123266 34.530253 EW? 0.309504 11.623 11.500 11.216 10.856 10.751 53 50 61 21 58 858993630922 WVSC-019 V* EH Lyn 135.667523 34.329637 EW 0.326744 13.383 13.347 13.117 12.903 12.804 81 84 113 96 113 858993632337 WVSC-020 UNC 316.035368 30.851989 WV? 0.153950 17.724 17.629 17.284 16.945 16.853 100 105 104 98 86 858993633031 WVSC-021 UNC 316.047441 30.885523 BD? 6.398 15.237 15.043 14.635 14.111 13.959 102 106 126 117 126 858993634274 WVSC-022 UNC 316.109244 30.942416 EB 0.68287 17.393 17.403 17.200 16.917 16.893 100 104 116 106 97 858993635978 WVSC-023 UNC 316.00418 31.013522 EB 0.254721 18.550 18.430 17.965 17.513 17.324 90 96 92 80 69 858993636075 WVSC-024 UNC 315.939706 31.017482 EB? 0.110912 18.124 17.894 17.345 16.737 16.564 99 102 114 112 116 858993637017 WVSC-025 UNC 315.868607 31.055426 EB 0.76859 14.497 14.426 14.212 13.974 13.900 103 106 126 117 115 858993640688 WVSC-026 UNC 316.392944 30.965097 EB 0.283741 17.438 16.911 16.248 15.628 15.282 100 104 125 117 126 858993642335 WVSC-027 UNC 316.478532 31.054465 EB? 0.382816 17.272 17.105 16.713 16.205 16.002 100 103 124 117 126 858993643289 WVSC-028 UNC 316.529965 30.835178 EB/EW 0.372206 17.789 17.601 17.264 16.924 16.804 8 7 53 64 110 858993643597 WVSC-029 UNC 316.546651 30.920522 EB? 1.13248 14.072 13.924 13.562 13.147 12.998 80 64 107 104 126 858993644865 WVSC-030 UNC 316.623841 31.005224 BD? 2.39238 14.459 14.363 13.993 13.462 13.324 17 15 36 30 35 858993651058 WVSC-031 UNC 316.552954 30.573486 EB 0.272796 15.902 15.745 15.460 14.940 14.828 99 104 125 116 127 858993651463 WVSC-032 UNC 316.509624 30.55661 EB 0.9995 12.831 12.768 12.592 12.349 12.348 102 102 123 103 100 858993651583 WVSC-033 UNC 316.440931 30.550424 EB 0.74530 17.161 16.964 16.566 16.007 15.850 101 104 122 115 127 858993653343 WVSC-034 UNC 316.398603 30.473811 EB/EW 0.289408 16.942 16.736 16.280 15.879 15.767 102 105 124 117 127 858993654890 WVSC-035 UNC 316.495184 30.398145 EB/EW 0.305103 15.326 15.189 14.857 14.502 14.384 101 104 126 117 127 858993657176 WVSC-036 UNC 316.117947 30.418146 EB/EW 0.205387 15.223 15.101 14.837 14.484 14.376 18 15 85 90 120 858993657640 WVSC-037 UNC 316.096904 30.449857 RR 0.64670 16.613 16.483 16.203 15.815 15.803 101 104 124 117 127 858993659737 WVSC-038 UNC 316.006495 30.546451 EB 0.41158 17.525 17.257 16.864 16.354 16.272 100 105 117 112 117 858993661749 WVSC-039 UNC 315.914246 30.446447 EB? 0.56763 17.310 17.072 16.499 15.937 15.680 101 102 124 117 127 858993661905 WVSC-040 1SWASP J210337.93+302659.2 315.908006 30.449801 EA 1.9353 10.626 10.549 10.330 10.144 10.034 3 4 60 21 83 858993670937 WVSC-041 UNC 112.290496 30.304305 EB 1.3317 15.177 15.124 14.869 14.585 14.516 64 72 86 79 88 858993671407 WVSC-042 UNC 112.186982 30.380001 EB 0.384516 17.432 17.093 16.481 15.926 15.603 64 72 85 79 87 858993673691 WVSC-043 UNC 112.610889 30.314442 MP? 1.3451 14.399 14.145 13.658 13.009 12.815 67 73 86 78 85 858993758351 WVSC-044 NGC 5272 338 205.502796 28.477732 RRc 0.329593 15.142 15.130 14.922 14.849 14.825 17 11 22 20 11 858993759574 WVSC-045 NGC 5272 279 205.483503 28.413613 RRab 0.558013 15.015 15.039 14.830 14.603 14.579 63 82 101 100 126 858993759604 WVSC-046 NGC 5272 278 205.48296 28.468236 RRab 0.529819 15.106 15.080 14.801 14.587 14.624 69 73 79 78 102 858993759856 WVSC-047 NGC 5272 264 205.478231 28.464431 RRab 0.519611 15.121 15.072 14.892 14.676 14.674 74 87 101 100 126 858993760097 WVSC-048 NGC 5272 253 205.473144 28.423797 RRc 0.326640 15.175 15.151 15.011 14.847 14.754 84 91 101 100 126 858993760236 WVSC-049 NGC 5272 249 205.470686 28.411781 RRab 0.587083 15.012 14.902 14.781 14.550 14.525 83 91 101 100 126 858993760605 WVSC-050 NGC 5272 234 205.462206 28.409174 RRab 0.551543 15.116 15.051 14.857 14.641 14.607 80 90 101 100 126 858993760902 WVSC-051 NGC 5272 223 205.454101 28.442241 RRab 0.640116 14.906 14.869 14.716 14.472 14.412 51 48 57 54 117 858993761631 WVSC-052 UNC 205.429057 28.40102 EB 0.445936 18.350 18.381 18.123 17.948 17.730 83 89 86 73 28 858993761656 WVSC-053 NGC 5272 190 205.428466 28.404882 RRab 0.773532 14.820 14.775 14.480 14.227 14.254 62 66 101 100 126 858993762099 WVSC-054 NGC 5272 181 205.40833 28.409307 RRab 0.501263 15.149 15.116 14.847 14.715 14.683 84 90 102 100 125 858993762390 WVSC-055 NGC 5272 170 205.391872 28.506926 RRab 0.514803 15.045 14.958 14.842 14.668 14.666 85 91 101 100 126 858993765388 WVSC-056 UNC 65.825989 26.68764 EB? 6.479 -9.999 14.047 12.553 11.022 10.113 1 47 67 28 15 858993765544 WVSC-057 UNC 65.806081 26.746206 RCB/EB? 10.019 -9.999 15.097 13.977 12.726 12.130 1 47 67 64 67 858993765662 WVSC-058 UNC 65.978024 26.770083 EB? 0.121704 -9.999 18.815 17.903 16.639 16.182 1 41 63 61 65 858993770774 WVSC-059 UNC 66.413625 26.119562 EB 0.419303 -9.999 17.013 16.540 15.915 15.687 0 45 69 64 70 858993772561 WVSC-060 UNC 65.962096 26.239973 MP? 2.5556 -9.999 13.305 13.053 12.758 12.635 0 52 70 64 69 Classifications taken from the literature and our classifications are marked by italics and normal fonts, respectively. The abbreviations of variability types follow the same convention as the GCVS (Samus et al. 1997). Uncertain classifications are marked with ‘?’.

Article number, page 15 of 21

Table 4. continued.

ID [WSA] ID [WVSC] ID RA [deg.] DEC [deg.] type P [d] ⟨Z⟩ ⟨Y⟩ ⟨J⟩ ⟨H⟩ ⟨K⟩ N_Z N_Y N_J N_H N_K 858993772880 WVSC-061 UNC 65.904342 26.119991 EB? 0.328507 -9.999 16.168 15.632 14.888 14.738 0 52 70 65 68 858993835928 WVSC-062 CSS_J042001.7+171645 65.007363 17.27938 WV 33.29 15.292 14.957 14.524 14.119 13.934 51 82 95 92 95 858993837402 WVSC-063 UNC 65.392169 17.113222 EB 0.626686 13.545 13.409 13.164 12.907 12.784 34 78 93 91 93 858993844067 WVSC-064 UNC 87.672286 16.231257 EB? 0.625369 14.951 14.751 14.328 13.826 13.697 89 119 136 131 136 858993844518 WVSC-065 UNC 87.75716 16.254779 RR? 0.161579 13.532 13.392 13.053 12.686 12.582 90 121 135 131 135 858993845424 WVSC-066 UNC 87.667203 16.307342 EB 1.6095 14.611 14.486 14.223 13.916 13.791 90 121 136 132 136 858993846025 WVSC-067 UNC 87.744499 16.337318 RR/EW? 0.387056 15.939 15.804 15.460 15.076 14.986 89 120 136 131 136 858993846345 WVSC-068 UNC 87.571443 16.356207 EB 0.382237 16.571 16.177 15.583 14.888 14.588 88 121 135 131 135 858993847117 WVSC-069 UNC 87.68201 16.397512 EB? 0.117309 17.294 17.132 16.665 16.206 16.065 89 121 136 131 136 858993847751 WVSC-070 UNC 87.740914 16.431696 UNC 0.257344 14.136 13.930 13.716 13.432 13.341 8 13 74 101 123 858993851860 WVSC-071 UNC 88.08328 16.416697 EB? 0.153861 16.394 16.197 15.803 15.323 15.198 101 121 137 131 135 858993852012 WVSC-072 V* AM Tau 88.089084 16.283537 EA/SD 2.04387 10.531 10.461 10.224 10.054 9.907 4 11 44 6 20 858993852658 WVSC-073 UNC 88.126444 16.367541 UNC 0.12815 17.237 16.960 16.617 16.184 15.983 98 121 138 132 135 858993854681 WVSC-074 UNC 88.215008 16.359551 EB/EW 0.187452 14.292 14.094 13.855 13.532 13.467 102 120 136 132 135 858993855085 WVSC-075 UNC 88.231993 16.247183 EB 0.148999 16.550 16.443 16.090 15.746 15.601 97 117 136 131 135 858993855285 WVSC-076 UNC 88.23866 16.390559 EB? 0.118653 17.793 17.449 16.926 16.195 16.101 85 117 134 130 131 858993860218 WVSC-077 UNC 88.195444 15.950907 RR? 0.120533 17.233 17.012 16.481 15.817 15.535 105 117 134 126 131 858993860697 WVSC-078 UNC 88.134228 15.923956 EB 0.321011 17.076 16.977 16.602 16.255 16.069 108 120 137 129 135 858993860784 WVSC-079 UNC 88.123632 15.918918 EB 0.85505 16.376 16.240 15.954 15.673 15.586 111 121 137 129 135 858993861924 WVSC-080 UNC 88.136087 15.854916 EB 0.302547 17.166 16.986 16.575 16.287 16.103 110 120 137 127 135 858993863119 WVSC-081 UNC 88.115593 15.78848 EB? 0.143696 17.793 17.591 17.158 16.589 16.452 93 119 133 125 133 858993867117 WVSC-082 UNC 87.726811 15.845016 RR/EW 0.31857 16.000 15.813 15.475 15.091 14.909 112 120 136 132 136 858993867644 WVSC-083 UNC 87.696811 15.916248 UNC 0.146051 17.605 17.478 17.054 16.730 16.636 103 120 135 131 133 858993875271 WVSC-084 V* HS Cnc 132.770127 11.765788 EW 0.359664 12.604 12.456 12.333 11.977 11.998 59 57 67 60 70 858993876013 WVSC-085 V* ES Cnc 132.836634 11.890588 EA/RS 0.532046 10.487 10.478 10.272 10.086 10.021 6 5 23 8 25 858993876386 WVSC-086 V* EV Cnc 132.867279 11.824295 EW/KW 0.441443 12.021 11.968 11.765 11.536 11.453 55 55 67 49 70 858993876850 WVSC-087 V* AH Cnc 132.907685 11.849185 EW/KW 0.360461 12.651 12.575 12.370 12.147 12.109 56 58 67 61 70 858993882292 WVSC-088 Cl* M67 XZD 3 132.339004 11.324518 EW 0.87684 14.187 14.068 13.770 13.385 13.302 58 56 67 61 69 858993882503 WVSC-089 CSS_J084911.7+112816 132.299364 11.471132 EA 0.284996 13.374 12.967 12.442 11.861 11.602 58 56 67 61 69 858993887204 WVSC-090 CSS_J231223.8+111339 348.099701 11.2279 RRd 0.290866 15.412 15.366 15.247 14.958 14.905 111 112 127 121 128 858993887341 WVSC-091 UNC 348.132532 11.22061 EB? 1.7476 13.079 13.023 12.787 12.501 12.439 110 111 127 121 128 858993887483 WVSC-092 UNC 348.174214 11.136043 EB? 2.7558 14.020 13.722 13.330 12.731 12.556 109 110 127 123 128 858993939587 WVSC-093 UNC 312.839437 6.558035 EB 1.3866 12.041 12.026 11.901 11.765 11.749 81 70 121 133 142 858993943395 WVSC-094 UNC 313.096957 6.636626 SR? 10.468 14.995 14.788 14.365 13.803 13.673 142 142 160 157 167 858993944520 WVSC-095 UNC 313.162131 6.580543 EB 0.401346 11.425 11.374 11.126 10.903 10.830 73 75 118 54 122 858993945235 WVSC-096 UNC 313.208491 6.758572 EB? 4.5955 13.797 13.593 13.270 12.879 12.770 13 8 56 72 136 858993946452 WVSC-097 UNC 313.299863 6.745278 RR/EW? 0.135439 17.929 17.872 17.606 17.231 17.192 138 140 137 143 111 858993949722 WVSC-098 UNC 313.145596 6.315533 EB 2.3951 14.369 14.049 13.546 12.874 12.680 142 142 162 156 167 858993950831 WVSC-099 CSS_J205225.3+061500 313.105533 6.25005 RRab 0.539025 16.272 16.226 15.984 15.735 15.624 141 142 161 155 164 858993951816 WVSC-100 CSS_J205306.4+061054 313.276707 6.18187 EA 0.84644 15.404 15.339 15.117 14.858 14.789 136 136 157 125 148 858993952160 WVSC-101 UNC 313.26843 6.15111 RR/EB? 0.138725 14.628 14.536 14.136 13.745 13.650 141 141 162 156 168 858993966899 WVSC-102 UNC 127.903487 5.90891 UNC 4.2395 17.785 17.529 17.167 16.597 16.394 70 86 90 87 91 858993968747 WVSC-103 UNC 246.734916 5.867772 EB 0.169992 15.821 15.533 15.052 14.449 14.216 58 71 77 72 78 858994013738 WVSC-104 CSS_J083048.8+053543 127.703875 5.595349 EW 0.271745 15.760 15.622 15.247 14.760 14.633 78 83 92 86 94 858994015625 WVSC-105 CSS_J082950.2+052907 127.459127 5.485724 EA 0.77666 15.638 15.487 15.115 14.615 14.508 80 87 93 86 94 858994019164 WVSC-106 UNC 247.06286 5.393468 UNC 0.137838 18.265 18.103 17.858 17.504 17.350 53 62 66 64 48 858994038856 WVSC-107 UNC 37.582983 5.336146 EB 0.668594 17.729 17.408 17.023 16.326 16.186 133 137 165 156 170 858994049073 WVSC-108 UNC 276.780429 4.398289 EB 0.340752 18.739 18.473 17.916 17.366 17.100 85 81 84 105 58 858994049801 WVSC-109 UNC 276.911346 4.408201 RR/EW 0.76913 15.978 15.795 15.458 15.077 14.965 140 137 162 156 173 858994049897 WVSC-110 UNC 276.849453 4.409432 EB 0.80548 16.188 15.924 15.486 14.965 14.698 18 19 49 51 138 858994050892 WVSC-111 UNC 276.794665 4.424061 UNC 0.165561 15.244 14.962 14.571 14.209 14.061 139 136 161 155 173 858994051306 WVSC-112 UNC 276.784711 4.429245 UNC 0.238509 16.977 16.711 16.450 16.108 15.990 69 80 143 133 159 858994052496 WVSC-113 UNC 276.89647 4.446575 EB/EW 0.314919 18.215 17.880 17.495 16.908 16.809 130 132 141 147 146 858994055019 WVSC-114 UNC 276.8638 4.478546 EB? 0.172668 16.904 16.736 16.108 16.083 15.700 3 6 7 4 12 858994060195 WVSC-115 UNC 276.742444 4.54425 EB? 0.11561 15.733 15.304 14.753 14.134 13.910 13 10 32 19 78 858994062582 WVSC-116 UNC 276.86547 4.574914 RR/EW 0.371865 15.244 15.021 14.598 14.120 13.953 134 131 162 150 167 858994062822 WVSC-117 UNC 276.851728 4.578325 EB/EW 0.254074 15.271 14.996 14.491 13.857 13.662 119 110 155 141 172 858994063832 WVSC-118 UNC 276.814626 4.590961 RR/EW 0.438051 16.591 16.359 15.938 15.458 15.277 23 23 94 94 153 858994070601 WVSC-119 UNC 277.14804 4.499637 EB? 12.270 13.508 13.163 12.721 12.129 11.941 23 15 28 14 12 858994070736 WVSC-120 UNC 277.15029 4.523363 EB 1.3113 14.641 14.454 14.083 13.722 13.590 143 134 162 156 170 Classifications taken from the literature and our classifications are marked by italics and normal fonts, respectively. The abbreviations of variability types follow the same convention as the GCVS (Samus et al. 1997). Uncertain classifications are marked with ‘?’.

Article number, page 16 of 21

Table 4. continued.

ID [WSA] ID [WVSC] ID RA [deg.] DEC [deg.] type P [d] ⟨Z⟩ ⟨Y⟩ ⟨J⟩ ⟨H⟩ ⟨K⟩ N_Z N_Y N_J N_H N_K 858994070811 WVSC-121 UNC 277.150469 4.595231 EB 3.8316 16.581 16.232 15.963 15.528 15.361 114 105 154 150 168 858994072980 WVSC-122 UNC 277.176302 4.420218 EB 0.264406 19.051 18.749 18.120 17.479 17.299 25 22 73 95 114 858994073171 WVSC-123 UNC 277.178676 4.550282 MP? 5.472 17.263 16.851 16.272 15.558 15.336 138 135 162 155 170 858994074662 WVSC-124 UNC 277.196447 4.560181 EB 0.374409 16.702 16.447 16.034 15.622 15.526 136 129 163 154 168 858994076256 WVSC-125 UNC 277.215337 4.486184 RR/EW 0.8331 16.796 16.573 16.210 15.833 15.719 143 136 161 154 170 858994079796 WVSC-126 UNC 277.25763 4.554943 RR/EW 0.341677 16.240 16.074 15.679 15.211 15.116 12 9 26 15 66 858994080120 WVSC-127 UNC 277.262228 4.49238 EB 0.458691 18.575 18.284 17.787 17.209 17.047 121 119 136 142 135 858994080599 WVSC-128 UNC 277.268224 4.523255 RR/EW 0.254256 17.293 16.995 16.525 15.899 15.647 138 136 160 155 168 858994081294 WVSC-129 UNC 277.275417 4.49851 RR/EW 0.307896 17.303 16.944 16.546 16.009 15.794 129 132 157 150 165 858994082135 WVSC-130 UNC 277.286238 4.482187 RR/EW 0.383838 16.405 16.138 15.732 15.245 15.076 104 72 136 130 167 858994083249 WVSC-131 UNC 277.300422 4.494767 RR/EB? 0.19091 16.479 16.237 15.842 15.427 15.197 138 132 161 156 167 858994084618 WVSC-132 UNC 277.316933 4.38251 EB/EW 0.254129 16.390 16.053 15.524 14.873 14.692 139 136 163 155 171 858994084790 WVSC-133 UNC 277.319647 4.495855 UNC 15.58 17.329 16.889 16.395 15.641 15.433 132 131 159 154 169 858994085602 WVSC-134 UNC 277.329943 4.541765 UNC 3.473 14.537 14.252 13.854 13.306 13.127 14 11 19 12 52 858994086541 WVSC-135 UNC 277.341697 4.491627 RR/EW 0.587292 16.120 15.907 15.565 15.258 15.153 128 119 161 155 170 858994087037 WVSC-136 UNC 277.347305 4.488313 UNC 26.11 12.484 12.096 11.542 10.933 10.707 18 8 18 5 10 858994087540 WVSC-137 UNC 277.354951 4.571934 EB 3.118 14.936 14.616 14.233 13.727 13.525 143 137 162 155 170 858994095070 WVSC-138 CSS_J010358.9+041652 15.995818 4.281104 RRab 0.575323 15.143 15.196 14.992 14.786 14.738 75 76 88 84 90 858994099626 WVSC-139 UNC 277.273265 4.158988 RR/EB? 0.128269 16.336 15.929 15.428 14.711 14.574 36 31 69 55 140 858994101162 WVSC-140 UNC 277.233983 4.140149 EB/EW 0.298692 18.542 18.257 17.763 17.155 16.959 119 126 134 147 133 858994107466 WVSC-141 UNC 277.34829 4.067802 EB 0.99218 17.148 16.766 16.223 15.582 15.386 136 138 159 158 173 858994108101 WVSC-142 UNC 277.172208 4.060249 EB? 0.160513 16.784 16.473 16.000 15.472 15.288 122 129 160 157 171 858994111443 WVSC-143 UNC 277.310182 4.020109 EB/EW 0.267722 17.345 17.069 16.457 15.643 15.493 95 86 107 93 125 858994112189 WVSC-144 UNC 277.332735 4.011781 EB 0.419459 17.487 17.311 16.812 16.421 16.273 9 11 49 57 148 858994112734 WVSC-145 UNC 277.171404 4.004526 EB 0.236334 17.710 17.350 16.698 16.063 15.763 130 137 154 156 167 858994114024 WVSC-146 UNC 277.294356 3.988936 EB 0.558301 15.873 15.623 15.221 14.769 14.696 75 72 150 145 174 858994117559 WVSC-147 UNC 277.174266 3.942675 EB/EW 0.384162 16.879 16.506 16.038 15.648 15.475 122 128 152 147 158 858994123424 WVSC-148 UNC 276.913721 4.069823 RR? 0.99668 16.228 15.956 15.501 14.971 14.820 143 135 162 158 174 858994123967 WVSC-149 UNC 276.907785 4.034868 EB? 0.168452 15.230 15.142 14.818 14.468 14.299 129 121 160 157 174 858994125146 WVSC-150 UNC 276.894251 4.157044 EB 1.4286 15.811 15.541 15.106 14.636 14.372 108 106 154 156 175 858994126322 WVSC-151 UNC 276.877906 4.021391 EB 0.214368 19.297 18.882 18.257 17.572 17.313 97 107 109 124 88 858994128309 WVSC-152 UNC 276.85326 3.963948 EB/EW 0.486239 14.273 14.063 13.869 13.621 13.543 147 139 162 160 175 858994130299 WVSC-153 UNC 276.828156 4.072047 EB/EW? 0.296823 17.213 16.991 16.548 15.913 15.745 137 137 156 157 169 858994133225 WVSC-154 UNC 276.79191 4.06399 EB? 0.106887 17.818 17.448 16.913 16.132 15.918 135 134 155 157 169 858994134670 WVSC-155 UNC 276.774204 4.146136 EB? 0.260904 17.019 16.841 16.551 16.242 16.025 140 139 158 158 170 858994136353 WVSC-156 UNC 276.755145 4.011131 EB/EW 0.391211 15.921 15.646 15.257 14.922 14.766 104 98 160 156 174 858994137609 WVSC-157 UNC 276.739613 3.997169 EB? 0.141144 16.546 16.259 15.809 15.177 15.052 139 138 161 158 174 858994141015 WVSC-158 UNC 276.698648 4.104768 EB/EW 0.343883 16.811 16.555 16.122 15.631 15.407 56 56 132 136 162 858994147641 WVSC-159 UNC 327.660034 2.804554 EB? 4.935 13.153 13.256 13.226 13.210 13.211 77 81 88 87 92 858994153826 WVSC-160 CSS_J215027.7+022053 327.615461 2.348312 EA 0.625233 15.027 14.762 14.407 13.880 13.728 78 80 88 86 93 858994156179 WVSC-161 UNC 276.935978 1.560587 EB 0.283568 18.623 18.029 17.262 16.479 16.190 70 77 90 92 92 858994156941 WVSC-162 UNC 276.9528 1.571462 EB/RR? 0.554038 15.928 15.621 15.144 14.698 14.444 79 82 95 94 98 858994157247 WVSC-163 UNC 277.102868 1.575781 EB? 3.475 13.750 13.252 12.566 11.764 11.431 80 84 97 84 98 858994159636 WVSC-164 UNC 276.979769 1.607771 EB 1.1430 13.122 12.815 12.297 11.824 11.589 38 31 69 76 97 858994160161 WVSC-165 UNC 277.00916 1.616507 EB 0.635727 15.111 14.752 14.267 13.719 13.534 78 83 96 94 99 858994160998 WVSC-166 UNC 277.081459 1.628414 RR 0.493887 15.723 15.322 14.795 14.340 14.107 38 24 61 37 59 858994161072 WVSC-167 UNC 277.130511 1.626704 EB/EW 0.40135 16.597 16.224 15.679 15.151 14.756 54 20 37 11 32 858994162898 WVSC-168 UNC 277.014425 1.655263 EB/EW 0.337809 17.786 17.328 16.642 15.957 15.644 74 71 89 69 80 858994162930 WVSC-169 UNC 277.123462 1.655642 UNC 15.07 17.294 16.665 15.885 14.992 14.617 77 85 97 94 98 858994164323 WVSC-170 UNC 276.952442 1.674158 EB 0.427359 15.800 15.396 14.860 14.318 14.050 31 27 49 32 84 858994166097 WVSC-171 UNC 277.127846 1.699677 EB? 19.19 13.911 13.239 12.368 11.376 10.970 80 81 97 53 78 858994166777 WVSC-172 UNC 277.049484 1.70924 EB 0.590672 15.567 15.130 14.717 14.232 13.975 17 17 60 65 85 858994167617 WVSC-173 UNC 277.13867 1.720901 EB? 0.229653 18.532 17.870 17.130 16.453 16.086 58 73 73 87 81 858994169243 WVSC-174 UNC 276.957323 1.741694 UNC 6.953 14.694 14.201 13.662 12.984 12.670 68 74 94 86 98 858994169652 WVSC-175 UNC 277.003086 1.747769 EB 2.879 16.414 15.955 15.299 14.592 14.295 19 11 32 27 59 858994179270 WVSC-176 UNC 277.372101 1.638812 EB/EW 0.256566 18.512 17.853 16.927 15.925 15.574 75 78 94 88 95 858994180272 WVSC-177 UNC 277.386605 1.602257 YSO? 0.428074 18.497 17.371 16.616 15.493 15.098 11 12 15 13 19 858994184234 WVSC-178 UNC 277.441187 1.680292 EB 0.363196 16.869 16.350 15.530 14.865 14.527 80 82 97 94 96 858994184777 WVSC-179 UNC 277.448741 1.72166 EB? 23.18 17.244 16.618 15.804 14.928 14.563 76 65 77 75 90 858994185486 WVSC-180 UNC 277.459249 1.737657 EB 0.646148 18.451 17.874 17.250 16.517 16.282 74 83 95 93 94 Classifications taken from the literature and our classifications are marked by italics and normal fonts, respectively. The abbreviations of variability types follow the same convention as the GCVS (Samus et al. 1997). Uncertain classifications are marked with ‘?’.

Article number, page 17 of 21

Table 4. continued.

ID [WSA] ID [WVSC] ID RA [deg.] DEC [deg.] type P [d] ⟨Z⟩ ⟨Y⟩ ⟨J⟩ ⟨H⟩ ⟨K⟩ N_Z N_Y N_J N_H N_K 858994185492 WVSC-181 UNC 277.4598 1.574162 YSO? 15.73 16.839 16.152 15.158 14.039 13.652 80 83 97 94 97 858994185583 WVSC-182 UNC 277.460796 1.665987 EB? 0.154698 18.301 17.699 16.948 16.168 15.792 47 28 42 28 65 858994188282 WVSC-183 UNC 277.502315 1.755299 EB/EW 0.320335 17.483 17.011 16.363 15.707 15.414 78 83 97 94 96 858994188840 WVSC-184 UNC 277.510772 1.682827 EB 20.53 16.365 15.776 15.021 14.269 13.895 69 47 65 65 89 858994189900 WVSC-185 UNC 277.527556 1.66504 EB 1.7273 15.503 14.899 14.112 13.314 12.892 79 84 98 92 97 858994190463 WVSC-186 UNC 277.537292 1.614219 EB 0.464769 18.133 17.450 16.608 15.704 15.317 74 84 97 93 95 858994190532 WVSC-187 UNC 277.538342 1.613278 YSO? 0.319961 19.474 18.755 17.720 16.634 16.208 47 71 87 92 93 858994190952 WVSC-188 UNC 277.546021 1.601353 EB 0.42278 18.825 18.151 17.363 16.557 16.164 69 78 95 93 94 858994191322 WVSC-189 UNC 277.551708 1.758849 EB 0.243305 19.066 18.547 17.785 17.048 16.548 32 21 49 48 71 858994192523 WVSC-190 UNC 277.571992 1.730603 EB 0.371316 19.425 18.703 17.962 17.006 16.718 53 70 84 86 84 858994204371 WVSC-191 UNC 277.416149 1.298901 YSO? 18.87 17.206 15.762 14.315 12.751 11.847 78 82 97 93 97 858994204509 WVSC-192 UNC 277.473393 1.283821 YSO? 6.005 14.651 13.777 12.662 11.398 10.585 79 81 97 79 68 858994204796 WVSC-193 UNC 277.505204 1.251004 EB 21.17 18.928 17.144 15.262 13.197 11.989 66 81 93 79 44 858994205140 WVSC-194 UNC 277.576518 1.222595 EB? 0.188161 -9.999 19.433 18.343 17.254 16.628 0 26 60 83 89 858994205206 WVSC-195 UNC 277.485634 1.21656 emphYSO? 7.583 18.730 16.839 14.850 12.800 11.505 70 81 94 93 7 858994205743 WVSC-196 UNC 277.484108 1.18262 EB? 0.96167 13.645 13.168 12.548 11.784 11.487 13 15 84 87 90 858994206042 WVSC-197 UNC 277.590175 1.153931 YSO? 0.667767 19.134 18.386 17.450 16.585 16.060 44 58 72 70 75 858994206112 WVSC-198 UNC 277.460586 1.149437 YSO? 21.64 16.377 15.404 14.314 13.101 12.470 78 83 97 93 97 858994206341 WVSC-199 UNC 277.586671 1.137345 YSO? 0.329667 17.491 16.671 15.708 14.879 14.419 74 81 93 91 95 858994209895 WVSC-200 UNC 277.457777 1.221444 RR 0.544529 -9.999 -9.999 18.510 16.627 15.632 0 0 53 93 96 858994219871 WVSC-201 UNC 277.139562 1.327211 EB 5.906 17.022 16.415 15.726 14.963 14.627 55 39 70 62 89 858994220487 WVSC-202 UNC 277.122954 1.121364 YSO? 0.400328 19.113 18.183 17.134 16.186 15.610 66 79 93 93 95 858994220537 WVSC-203 UNC 277.121224 1.298132 EB 0.841011 16.382 15.816 15.132 14.449 14.098 79 64 82 56 81 858994221574 WVSC-204 UNC 277.096939 1.252016 YSO? 0.439253 17.644 16.795 15.711 14.716 14.208 77 83 96 93 96 858994221693 WVSC-205 UNC 277.09461 1.131475 EB 0.439553 18.178 17.422 16.459 15.626 15.220 74 82 96 93 96 858994221943 WVSC-206 UNC 277.089541 1.248506 CEP 24.902686 13.907 13.234 12.329 11.348 10.907 80 82 97 55 76 858994223585 WVSC-207 UNC 277.050452 1.13304 EB/EW 0.35281 14.417 13.744 12.917 12.142 11.732 80 78 93 72 83 858994224223 WVSC-208 UNC 277.034294 1.279217 YSO? 0.336704 19.421 18.638 17.742 16.677 16.172 55 68 83 82 88 858994224606 WVSC-209 UNC 277.028616 1.3228 LPV 589 12.631 11.270 -9.999 -9.999 -9.999 29 2 1 0 1 858994229958 WVSC-210 UNC 276.931986 1.280313 EB/EW 0.393258 17.443 16.966 16.317 15.699 15.402 10 6 15 18 47 858994230231 WVSC-211 UNC 276.927346 1.134655 EB 0.296819 17.611 17.007 16.258 15.471 15.062 75 83 95 93 96 858994265049 WVSC-212 UNC 340.48699 0.829007 RR/EB 0.399192 13.145 12.944 12.540 11.982 11.865 89 94 102 98 114 858994297149 WVSC-213 [SIG2010] 834454 340.01985 0.710009 RR 0.576612 16.402 16.254 16.057 15.793 15.754 62 70 101 96 111 858994310783 WVSC-214 V* UV Vir 185.319715 0.367486 RRab 0.587087 11.247 11.164 10.949 10.814 10.766 51 60 89 48 81 858994318617 WVSC-215 FASTT 298 111.43549 -0.128038 EB 0.826057 13.007 12.952 12.747 12.544 12.512 24 29 35 34 38 858994319794 WVSC-216 UNC 111.494443 -0.213772 RR/EB 0.507482 17.335 17.351 17.076 16.912 16.765 22 26 34 32 35 858994321303 WVSC-217 UNC 111.582157 -0.214957 RR/EB 0.89386 15.390 15.358 15.175 15.060 15.011 6 3 29 33 38 858994337501 WVSC-218 UNC 111.605321 -0.657989 UNC 0.201479 16.301 16.164 15.823 15.514 15.334 24 28 34 33 36 858994340477 WVSC-219 UNC 111.089689 -0.626147 EB 0.990329 16.299 16.162 15.982 15.701 15.651 28 30 34 33 37 858994341407 WVSC-220 UNC 111.04202 -0.64185 RR 0.229752 15.758 15.641 15.395 15.218 15.169 28 30 34 33 37 858994348010 WVSC-221 UNC 95.601731 -0.553746 EB/EW 0.288438 17.098 16.807 16.266 15.703 15.499 32 31 49 48 59 858994348596 WVSC-222 UNC 95.765311 -0.526899 RR/EB 0.331379 16.966 16.779 16.336 16.007 15.823 51 55 58 58 59 858994349033 WVSC-223 UNC 95.682378 -0.502859 EB 0.452372 16.749 16.591 16.280 16.001 15.825 51 55 58 58 60 858994351580 WVSC-224 UNC 96.044701 -0.652364 EB 0.292612 14.868 14.614 14.164 13.587 13.448 53 54 58 58 59 858994352002 WVSC-225 UNC 96.064085 -0.511952 UNC 0.182818 14.218 14.053 13.702 13.322 13.210 53 54 58 58 59 858994352228 WVSC-226 UNC 96.075004 -0.554772 EB 0.531101 15.972 15.763 15.365 14.961 14.737 53 53 58 58 59 858994354729 WVSC-227 UNC 96.182115 -0.628724 EB 0.448662 16.891 16.438 15.801 15.073 14.852 48 49 33 50 57 858994361770 WVSC-228 UNC 57.119609 -0.896043 EB 0.574468 15.340 15.169 14.788 14.345 14.217 24 24 26 26 28 858994367441 WVSC-229 UNC 96.181405 -1.088988 RR? 0.243558 17.093 16.851 16.531 16.127 16.028 51 55 58 57 59 858994367995 WVSC-230 UNC 96.220209 -1.115657 RR/EB 0.231026 18.354 18.041 17.593 17.039 16.812 48 54 51 56 51 858994371345 WVSC-231 UNC 95.74116 -1.061272 EB 0.370938 16.777 16.582 16.265 15.892 15.897 55 55 58 58 60 858994373269 WVSC-232 UNC 95.648458 -1.143842 EB/EW 0.335824 14.594 14.492 14.162 13.808 13.729 55 55 58 58 60 858994374528 WVSC-233 UNC 95.593047 -1.099817 EB/EW 0.686749 12.396 12.329 12.121 11.955 11.907 55 55 58 58 60 858994374652 WVSC-234 UNC 95.587004 -1.081912 EB/EW 0.537012 15.379 15.287 15.009 14.729 14.644 55 55 58 58 60 858994381046 WVSC-235 CSS_J231823.3-022107 349.597457 -2.352035 EW/CV 0.297842 13.108 12.989 12.692 12.303 12.228 43 44 47 48 48 858994382044 WVSC-236 UNC 349.022253 -2.378922 EB? 0.342663 14.524 14.496 14.291 14.178 14.134 45 42 46 45 45 858994409896 WVSC-237 UNC 227.618657 -3.015629 EB 0.318005 15.510 15.434 15.246 15.194 15.124 58 67 67 65 71 858994410179 WVSC-238 UNC 227.545526 -3.015991 EB 0.322653 14.811 14.675 14.249 13.676 13.610 60 67 67 65 71 858994410343 WVSC-239 CSS_J151000.2-030532 227.501143 -3.092319 RRab 0.669388 15.353 15.314 15.036 14.741 14.670 60 67 67 65 71 858994412940 WVSC-240 UNC 105.030981 -4.519903 EB 1.32266 14.947 14.491 13.936 13.494 13.204 22 28 31 27 26 Classifications taken from the literature and our classifications are marked by italics and normal fonts, respectively. The abbreviations of variability types follow the same convention as the GCVS (Samus et al. 1997). Uncertain classifications are marked with ‘?’.

Article number, page 18 of 21

Table 4. continued.

ID [WSA] ID [WVSC] ID RA [deg.] DEC [deg.] type P [d] ⟨Z⟩ ⟨Y⟩ ⟨J⟩ ⟨H⟩ ⟨K⟩ N_Z N_Y N_J N_H N_K 858994413404 WVSC-241 UNC 104.903112 -4.496257 UNC 0.152912 16.103 15.743 15.237 14.773 14.550 22 27 31 30 31 858994414908 WVSC-242 UNC 104.875286 -4.422119 RR/EB 0.744627 17.998 17.235 16.513 15.945 15.474 22 28 30 30 31 858994415042 WVSC-243 UNC 105.014402 -4.416299 EB 2.8850 17.167 16.581 15.840 14.991 14.724 18 24 30 29 31 858994415714 WVSC-244 UNC 105.013866 -4.387334 EB 0.217908 16.510 16.138 15.525 14.942 14.611 20 28 31 30 31 858994422475 WVSC-245 UNC 105.398853 -4.388151 EB 0.656726 13.908 13.745 13.378 13.046 12.828 19 26 30 31 33 858994422594 WVSC-246 UNC 105.404081 -4.560224 EB 0.505471 17.321 16.929 16.420 15.901 15.698 27 28 30 31 33 858994423841 WVSC-247 UNC 105.453082 -4.404012 EB 0.512576 13.837 13.665 13.414 13.215 13.137 27 28 30 29 29 858994424519 WVSC-248 UNC 105.478061 -4.568531 EB 0.570479 17.761 17.362 16.795 16.272 16.043 27 28 30 31 32 858994428739 WVSC-249 UNC 105.396673 -4.82021 EB 0.329578 14.271 14.157 13.840 13.518 13.437 24 28 30 31 33 858994428792 WVSC-250 UNC 105.491139 -4.822447 EB 0.324897 16.099 15.816 15.353 14.795 14.660 24 28 30 31 33 858994429145 WVSC-251 UNC 105.274017 -4.837617 EB 0.41921 16.758 16.396 15.804 15.349 15.135 23 28 30 31 33 858994430504 WVSC-252 UNC 105.395098 -4.892489 EB/EW 0.368882 14.307 14.144 13.794 13.470 13.367 13 23 29 31 33 858994432145 WVSC-253 UNC 105.419625 -4.9671 EB 1.64628 15.397 15.040 14.626 14.264 14.081 24 28 30 31 33 858994432386 WVSC-254 UNC 105.352064 -4.977902 RR/EB 0.395381 15.720 15.426 15.022 14.606 14.468 24 28 30 31 33 858994436336 WVSC-255 UNC 105.048671 -4.825992 UNC 0.259225 17.504 16.956 16.326 15.716 15.485 24 24 29 30 33 858994437507 WVSC-256 UNC 104.98936 -4.833235 EB 0.802163 17.431 16.761 15.929 15.133 14.735 28 28 31 31 33 858994438196 WVSC-257 UNC 104.951011 -4.893503 EB 0.302088 14.194 13.933 13.532 13.088 12.945 28 26 29 31 33 858994438678 WVSC-258 UNC 104.926238 -4.853502 YSO? 1.52303 17.413 16.636 15.672 14.611 14.010 2 2 6 8 19 858994439026 WVSC-259 UNC 104.906845 -4.85811 YSO? 8.797 18.490 17.566 16.695 15.799 15.134 22 25 29 31 33 858994439036 WVSC-260 UNC 104.906424 -4.850285 EB 0.725106 16.209 15.640 14.908 14.073 13.755 28 28 30 23 21 858994439058 WVSC-261 UNC 104.905268 -4.948258 EB? 1.42366 16.910 16.348 15.639 14.856 14.472 28 28 31 31 33 858994439165 WVSC-262 UNC 104.898968 -4.940107 EB 2.0099 15.916 15.174 14.315 13.441 13.046 28 28 31 31 33 858994439220 WVSC-263 UNC 104.897316 -4.82314 EB 20.35 17.864 17.111 16.215 15.300 14.875 28 26 29 30 32 858994439428 WVSC-264 UNC 104.888311 -4.810579 UNC 1.142318 17.967 17.209 16.506 15.481 15.155 28 28 31 31 31 858994439467 WVSC-265 UNC 104.886925 -4.963575 EB 0.354695 16.666 16.098 15.402 14.786 14.470 28 28 31 31 33 858994439549 WVSC-266 UNC 104.88414 -4.79966 EB 1.3380 16.670 16.037 15.397 14.514 14.298 28 27 30 30 31 858994440242 WVSC-267 UNC 104.855082 -4.982742 YSO? 0.773794 18.429 17.723 16.828 15.798 14.953 28 28 30 30 31 858994446505 WVSC-268 CSS_J110811.0-051426 167.046154 -5.240836 ELL/CV 0.2137 17.955 17.803 17.527 17.188 17.056 53 66 73 65 66 858994451885 WVSC-269 V* HM Vir 199.382366 -5.51931 RRab 0.510803 16.196 16.149 15.918 15.615 15.680 35 39 47 42 43 858994466023 WVSC-270 UNC 28.182364 -7.267357 EB 1.99255 17.225 17.147 16.835 16.247 15.220 66 66 82 78 96 858994470344 WVSC-271 CSS_J085550.9-080128 133.962395 -8.024383 EW/CV 0.261622 16.245 16.048 15.548 15.030 14.840 15 16 14 17 16 858994483134 WVSC-272 UNC 129.133389 -10.175506 UNC 0.11853 14.408 14.365 14.089 13.833 13.734 11 10 11 11 11 858994488202 WVSC-273 UNC 331.735959 -11.177177 RR 0.398636 16.289 16.260 15.980 -9.999 15.717 22 21 20 0 22 858994500379 WVSC-274 UNC 158.417977 -11.674168 EB? 0.126294 17.851 17.757 17.423 16.948 16.799 54 59 65 57 54 858994708201 WVSC-275 UNC 311.140507 -19.969578 EB 0.810869 13.067 12.984 12.739 12.435 12.347 39 37 38 37 38 Classifications taken from the literature and our classifications are marked by italics and normal fonts, respectively. The abbreviations of variability types follow the same convention as the GCVS (Samus et al. 1997). Uncertain classifications are marked with ‘?’.

Article number, page 19 of 21

Table 6. Objects showing no main periodicity in the WFCAM Variable Star Catalog (C2).

ID [WSA] ID [WVSC] ID RA [deg.] DEC [deg.] type ⟨Z⟩ ⟨Y⟩ ⟨J⟩ ⟨H⟩ ⟨K⟩ N_Z N_Y N_J N_H N_K 858993544270 WVSC-276 UNC 9.60267 37.340321 UNC 19.896 19.621 19.041 18.353 -9.999 29 30 16 12 0 858993598521 WVSC-277 UNC 250.220346 36.687414 UNC 17.654 17.434 17.224 16.700 16.361 69 73 82 75 83 858993651900 WVSC-278 UNC 316.497648 30.537663 LPV? 13.520 13.445 13.181 12.886 12.804 34 45 113 108 126 858993762538 WVSC-279 UNC 205.382225 28.403026 UNC 14.304 14.082 13.652 13.081 12.927 72 80 102 100 126 858993819409 WVSC-280 UNC 194.645106 21.684437 LPV? 19.048 19.106 18.017 17.915 17.118 79 83 111 85 115 858993855908 WVSC-281 UNC 88.255024 16.337922 UNC 14.392 14.174 13.836 13.409 13.319 37 42 42 42 55 858993855917 WVSC-282 UNC 88.255236 16.41061 LPV? 13.018 12.772 12.463 12.096 12.023 15 6 13 16 40 858993939621 WVSC-283 UNC 312.800524 6.562438 LPV? 14.810 14.617 14.194 13.669 13.523 140 142 161 158 169 858994070042 WVSC-284 UNC 277.142857 4.492954 UNC 19.753 19.496 18.706 18.393 17.773 57 50 29 16 6 858994107881 WVSC-285 UNC 277.314072 4.063078 LPV? 15.721 15.310 14.674 14.031 13.806 143 142 163 159 176 858994134565 WVSC-286 UNC 276.774679 3.97807 UNC 19.950 19.570 18.870 18.296 17.490 22 27 19 21 3 858994134763 WVSC-287 UNC 276.772146 3.978368 UNC 19.647 19.211 18.578 17.827 17.431 42 55 45 47 29 858994154118 WVSC-288 UNC 327.576885 2.438248 LPV? 14.183 13.939 13.553 12.984 12.816 56 58 85 85 93 858994154225 WVSC-289 UNC 327.556015 2.276469 UNC 17.070 16.660 16.414 15.639 15.463 49 57 68 63 60 858994204140 WVSC-290 UNC 277.56926 1.316825 YSO? 13.916 12.766 11.558 10.196 9.597 47 41 41 5 7 858994204193 WVSC-291 UNC 277.383256 1.311831 LPV? 15.491 14.050 12.289 10.515 -9.999 79 80 95 2 1 858994204967 WVSC-292 UNC 277.492509 1.256015 UNC 15.276 14.162 12.695 -9.999 -9.999 43 38 25 1 1 858994204998 WVSC-293 UNC 277.575778 1.237988 YSO? 15.709 14.663 13.459 12.134 11.352 80 80 96 92 97 858994205032 WVSC-294 UNC 277.496863 1.235462 UNC 13.797 12.856 11.746 -9.999 -9.999 61 42 26 0 1 858994205134 WVSC-295 UNC 277.479986 1.222807 YSO? 19.706 18.021 15.938 13.677 12.160 37 79 94 92 96 858994205141 WVSC-296 UNC 277.463285 1.222107 YSO? 19.072 17.459 15.873 14.355 13.428 65 79 93 90 93 858994205171 WVSC-297 UNC 277.435579 1.219811 YSO? 14.749 14.022 13.173 12.242 11.734 78 81 95 92 96 858994205305 WVSC-298 UNC 277.511449 1.207796 YSO? 20.153 17.979 15.211 12.089 9.931 7 79 92 90 3 858994205383 WVSC-299 UNC 277.532101 1.201199 YSO? 14.611 13.453 12.188 10.828 10.023 79 82 96 35 23 858994205505 WVSC-300 UNC 277.40703 1.191604 NP/SR? 14.684 12.811 11.209 -9.999 -9.999 78 42 38 0 1 858994205553 WVSC-301 UNC 277.406643 1.188126 LPV? 14.651 12.742 11.075 -9.999 -9.999 79 81 71 0 1 858994205754 WVSC-302 UNC 277.442875 1.173697 NP/SR? 14.722 13.922 13.150 12.393 11.825 79 82 85 47 38 858994206536 WVSC-303 UNC 277.422811 1.127185 YSO? 13.496 12.738 11.809 10.757 9.833 79 75 90 5 3 858994206594 WVSC-304 UNC 277.433076 1.122418 YSO? 16.367 15.469 14.355 12.951 11.869 78 80 96 86 93 858994206649 WVSC-305 UNC 277.475401 1.119668 YSO? 17.706 16.548 15.321 14.119 13.137 73 81 96 93 97 858994207598 WVSC-306 UNC 277.482131 1.242057 YSO? 19.077 17.944 15.832 13.223 11.324 14 16 22 2 2 858994230405 WVSC-307 UNC 276.925053 1.11366 YSO? 13.566 12.750 11.861 10.819 10.423 61 52 56 47 73 858994315350 WVSC-308 UNC 111.160633 -0.059965 UNC 15.646 15.465 15.052 14.594 14.376 27 30 35 33 37 858994352199 WVSC-309 UNC 96.073092 -0.620872 UNC 13.752 13.601 13.214 12.804 12.692 37 30 56 57 59 858994355033 WVSC-310 UNC 96.196091 -0.685057 UNC 16.378 16.039 15.472 14.789 14.560 53 54 58 58 59 858994412440 WVSC-311 UNC 104.848537 -4.545668 UNC 13.269 12.960 12.469 11.918 11.728 22 28 31 27 31 858994422260 WVSC-312 UNC 105.390262 -4.411119 UNC 12.725 12.409 11.890 11.321 11.113 19 12 27 19 28 858994438549 WVSC-313 UNC 104.93105 -4.819259 YSO? 16.900 15.964 14.736 13.355 12.188 28 28 31 31 33 858994438708 WVSC-314 UNC 104.923103 -4.889613 YSO? 16.665 15.917 15.002 13.847 13.133 28 28 30 31 33 858994438712 WVSC-315 UNC 104.922973 -4.870133 UNC 16.044 15.542 14.773 13.846 13.089 28 28 30 31 33 858994438816 WVSC-316 UNC 104.916249 -4.845457 YSO? 18.895 18.021 17.045 15.923 15.317 26 28 30 31 33 858994439495 WVSC-317 UNC 104.888734 -4.851078 YSO? 18.244 17.336 16.505 15.509 14.879 12 10 26 29 32 858994440327 WVSC-318 UNC 104.852175 -4.86141 LPV? 15.250 14.996 14.537 14.011 13.848 28 28 31 31 33 858994711814 WVSC-319 UNC 311.096694 -20.602106 UNC 19.389 19.045 18.585 17.854 17.319 24 22 12 12 3 Classifications taken from the literature and our classifications are marked by italics and normal fonts, respectively. The abbreviations of variability types follow the same convention as the GCVS (Samus et al. 1997). Uncertain classifications are marked with ‘?’.

Article number, page 20 of 21

Table 8. Periodic objects in the WFCAM Variable Star Catalog non-detection as variables by our analysis (C3).

ID [WSA] ID [WVSC] ID RA [deg.] DEC [deg.] type P [d] ⟨Z⟩ ⟨Y⟩ ⟨J⟩ ⟨H⟩ ⟨K⟩ N_Z N_Y N_J N_H N_K 858993538871 WVSC-320 2MASS J03314856+3723373 +52.9523380 +37.3937120 EA 11.778 10.549 10.454 10.297 10.107 10.018 8 7 19 10 21 858993758877 WVSC-321 Cl* NGC 5272 SAW V295 +205.4939460 +28.4663960 SX 0.036141 17.943 17.846 17.797 17.606 17.509 82 90 97 92 62 858993852017 WVSC-322 V0726 Tau +88.0894190 +16.2985490 EB 1.984 10.778 -9.999 10.619 10.516 10.461 2 0 52 13 58 858993875365 WVSC-323 HT Cnc +132.7801110 +11.8838720 EB 1.440 11.576 -9.999 11.171 10.769 10.620 3 1 4 3 10 858993875597 WVSC-324 HU Cnc +132.8056520 +11.8611550 EB/RS 18.390 12.057 11.872 11.497 10.936 10.862 56 55 65 28 61 858993875889 WVSC-325 HV Cnc +132.8249810 +11.7650460 Al 10.338 11.885 11.827 11.609 11.349 11.296 49 48 67 42 67 858993875909 WVSC-326 Cl* NGC 2682 SAND 1045 +132.8292450 +11.8349220 EB 7.645 11.665 11.601 11.382 11.131 11.076 40 40 65 38 67 858993875934 WVSC-327 HX Cnc +132.8320450 +11.8696420 RS 2.600 12.997 12.915 12.663 12.351 12.276 58 58 67 61 70 858993875953 WVSC-328 HW Cnc +132.8278720 +11.7840740 RS 9.200 11.428 11.309 11.002 10.598 10.501 35 31 54 16 39 858993876110 WVSC-329 Cl* NGC 2682 SAND 1024 +132.8454760 +11.8137200 EB 7.160 11.858 11.801 11.591 11.347 11.300 40 40 45 35 50 858993876313 WVSC-330 EU Cnc +132.8632600 +11.7824810 AM 0.087 19.506 18.848 18.538 17.851 17.536 36 49 38 41 38 858993876637 WVSC-331 EW Cnc +132.8857330 +11.8446110 DSCTC 0.053 11.807 11.739 11.705 11.617 11.598 14 13 47 44 66 858993876738 WVSC-332 EX Cnc +132.8929700 +11.8529080 DSCTC 0.048 10.482 10.476 10.381 10.294 10.277 7 8 24 10 29 858993876805 WVSC-333 NSV 18065 +132.9000270 +11.7759840 EB 31.780 11.704 11.608 11.353 11.041 10.978 46 45 56 25 60 858994362096 WVSC-334 SDSS J034917.41-005917.9 +57.3225360 -0.9887000 WV 0.004 17.931 18.234 18.276 18.358 -9.999 23 24 23 14 1 The missed sources in our broad selection are marked by italics.

The abbreviations of variability types follow the same convention as the GCVS (Samus et al. 1997).

Article number, page 21 of 21