arXiv:1407.7837v1 [astro-ph.SR] 29 Jul 2014

The Solar Neighborhood XXXV: Distances to 1404 M Dwarf Systems Within 25 pc in the Southern Sky

Jennifer G. Winters^1, Wei-Chun Jao^1, Sergio B. Dieterich^1 Department of Physics and Astronomy, Georgia State University, Atlanta, GA 30302-4106

winters@astro.gsu.edu, jao@astro.gsu.edu, dieterich@astro.gsu.edu

John C. Lurie^1 Astronomy Department, University of Washington, Seattle, WA 98195

lurie@uw.edu

Todd J. Henry^1, Altonio D. Hosey^1, Kenneth J. Slatten, Mark R. Boyd^1, Philip A. Ianna^1 RECONS Institute, Chambersburg, Pennsylvania, 17201

thenry@astro.gsu.edu, hosey@astro.gsu.edu, kslatten@cpinternet.com,
            boyd@astro.gsu.edu, philianna3@gmail.com

Nigel C. Hambly Scottish Universities Physics Alliance (SUPA), Institute of Astronomy, University of Edinburgh, Royal Observatory, Blackford Hill, Edinburgh EH9 3HJ, Scotland, UK

nch@roe.ac.uk

Adric R. Riedel^1 Hunter College/American Museum of Natural History, NYC, NY

ar494@hunter.cuny.edu

John P. Subasavage^1 US Naval Observatory, Flagstaff Station, 10391 West Observatory Road, Flagstaff, AZ 86001

jsubasavage@nofs.navy.mil

and Charlie T. Finch^1

– 2 –

Jennifer L. Bartlett^1

US Naval Observatory, 3450 Massachussetts Ave. NW, Washington, DC 20392

finch@usno.navy.mil, jennifer.bartlett@usno.navy.mil

ABSTRACT

We present trigonometric, photometric, and photographic distances to 1748 southern (δ ≤0^∘) M dwarf systems with μ ≥ 0.^{′′}18 yr^{−1}, of which 1404 are believed to lie within 25 parsecs of the Sun. The stars have 6.67 ≤ V_J ≤ 21.38 and 3.50 ≤ (V_J − K_s) ≤ 9.27, covering the entire M dwarf spectral sequence from M0.0V through M9.5V. This sample therefore provides a comprehensive snapshot of our current knowledge of the southern sky for the nearest M dwarfs that dominate the stellar population of the Galaxy. Roughly one-third of the 1748 systems, each of which has an M dwarf primary, have published high quality parallaxes, including 179 from the RECONS astrometry program. For the remaining systems, we offer photometric distance estimates that have well-calibrated errors. The bulk of these (∼700) are based on new V_J R_{KC} I_{KC} photometry acquired at the CTIO/SMARTS 0.9m telescope, while the remaining 500 primaries have photographic plate distance estimates calculated using SuperCOSMOS B_J R_{59F} I_{IV N} photometry. Confirmed and candidate subdwarfs in the sample have been identified, and a census of companions is included.

Subject headings: stars: distances — stars: low mass — stars: statistics — solar neighborhood — techniques: photometric — parallaxes

1. Introduction

There is great interest in developing a comprehensive list of nearby M dwarfs for studies of the Milky Way’s stellar population, both as astrophysically compelling individual objects and as prime targets for exoplanet and SETI search lists. These stars, typically called red dwarfs, dominate the stellar population of our Galaxy, accounting for more than 75%

1Visiting Astronomer, Cerro Tololo Inter-American Observatory. CTIO is operated by AURA, Inc. under contract to the National Science Foundation.

– 3 –

of all main sequence stars in the solar neighborhood (Henry et al. 2006).^1 Yet, distance determinations for red dwarfs have remained a challenge. Trigonometric parallaxes are the optimal tool for calculating distances, but because of observing time and resource constraints, distance estimation methods are attractive alternatives and are often a preliminary step in determining which targets are to be added to parallax programs.

There are two primary sources of trigonometric parallax data currently available. The Yale Trigonometric Parallaxes, Fourth Edition (van Altena et al. 1995), often called the Yale Parallax Catalogue (hereafter YPC), is a valuable compendium of ground-based parallaxes published prior to 1995 and includes about half of the southern M dwarf parallaxes measured to date. The Hipparcos mission (initial release by Perryman et al. (1997), and the updated results by van Leeuwen (2007); hereafter HIP) updated many of those parallaxes, and contributed almost two hundred new measurements for mostly bright (V ≲ 12.5) southern M dwarfs.

Since then, the RECONS (REsearch Consortium On Nearby Stars) group has measured a substantial number of parallaxes to nearby stars to date, adding 154 M dwarf systems to the 25 pc census (Jao et al. 2005; Costa et al. 2005; Henry et al. 2006; Costa et al. 2006; Subasavage et al. 2009; Riedel et al. 2010; Jao et al. 2011; Riedel et al. 2011; von Braun et al. 2011; Mamajek et al. 2013; Jao et al. 2014; Dieterich et al. 2014; Riedel et al. 2014), published in The Solar Neighborhood series of papers (hereafter TSN) in The Astronomical Journal. This effort has increased the number of M dwarf systems with accurate trigonometric parallaxes in the southern sky by 35%, with several hundred more determinations underway.

Both in addition to and in combination with proper motion surveys, optical photometry has historically been used to identify and characterize nearby stars. The first generation of sky surveys for intrinsically faint, nearby stars included the work of Luyten (1979a,b, 1980a,b) and Giclas et al. (1971, 1978). The work continued into the late twentieth century via the efforts of Bessel (1990); Bessell (1991), Weis (1984, 1986, 1987, 1988, 1991a,b, 1993, 1994, 1996, 1999), Wroblewski & Torres (1989, 1990, 1991, 1992, 1994, 1995, 1996, 1997, 1998), and Wroblewski & Costa (1999, 2000, 2001). More recent surveys include the SAAO group (Kilkenny & Cousins 1995; Kilkenny et al. 1998, 2007; Koen et al. 2002, 2010; Reid et al. 2001, 2002, 2003, 2004), Lépine (Lépine et al. 2002, 2003; Lépine 2005a,b, 2008; Lépine & Gaidos 2011), the USNO (Finch et al. 2010, 2012), and Deacon (Deacon et al. 2005a,b; Deacon & Hambly 2007; Deacon et al. 2009a,b), as well as RECONS’ efforts in the southern sky (Hambly et al. 2004; Henry et al. 2004; Subasavage et al. 2005a,b; Finch et al. 2007;

1Updated counts provided at www.recons.org.

– 4 –

Winters et al. 2011; Boyd et al. 2011a,b). This work is a continuation in that tradition, and includes a comprehensive assessment of the known population of red dwarfs in the southern sky, with a particular emphasis on those closer than a 25 pc horizon.

2. Definition of the Sample

We have developed a list of 1748 southern (δ ≤0^∘) stellar systems containing M dwarf primaries.^2 Here we define an M dwarf to be a star with 3.50 ≤ (V_J −K_s) ≤ 9.27, corresponding to spectral types M0.0V to M9.5V, where the red cut-off has been defined by Henry et al. (2004). This list is a combination of objects with existing high quality parallaxes, objects for which we have measured photometry as part of our southern astrometry/photometry program, and known objects that were recovered during our SuperCOSMOS-RECONS (SCR) proper motion searches for new nearby stars. To eliminate any red giants that may slip into this sample and to be consistent with the proper motion cut-off of Luyten, we limit our targets to those with proper motions, μ, greater than 0.^{′′}18 yr^{−1}.

Table 1 provides the observed data for the entire sample, including the name of the M dwarf primary, the number of known components in the system, coordinates (J2000.0), proper motion magnitude and position angle with reference, the weighted mean of the published trigonometric parallaxes and the error, the number of parallaxes included in the weighted mean and references, SuperCOSMOS B_J R_{59F} I_{IV N} plate magnitudes (hereafter simply BRI), V_J R_{KC} I_{KC} (hereafter simply V RI) measured by RECONS at Cerro Tololo Inter-American Observatory (CTIO) and the number of observations, or V RI from a trusted source and the reference, and 2MASS JHK_s magnitudes. The table is divided into the 1404 systems within 25 pc (top) and the 344 systems beyond 25 pc (bottom). A number in parentheses next to the number of components column indicates how many of the components are included in the photometry. All proper motions are from SuperCOSMOS, except where noted.^3 ’J’ next to a magnitude indicates that light from a close companion has resulted

2We refer to any collection of stars and their companion brown dwarfs and/or exoplanets as a system, including single M dwarfs not currently known to have any companions. Systems that contain a white dwarf component have been omitted, as the white dwarf was initially the brighter primary component.

3Some of the proper motion values from the SuperCOSMOS Sky Survey for SCR objects presented here differ slightly from those in the original discovery papers. For the new values, a more comprehensive method has been used that provides multiple measurements of proper motion between various plate pairs, while before only a single value was available that incorporated all plates into the solution simultaneously. The proper motions provided here are those that yield consistent values among multiple determinations and are preferred.

– 5 –

in blended photometry. A ’u’ next to the photometry reference code indicates that we have previously published photometry for this object, but have since then acquired more data and updated the value.

Each system has at least one of three different distance determinations, listed in Table 2, with the best distance either photographic (pltdist, 500 systems), photometric (ccddist, 667), or trigonometric (trgdist, 581).^4 Most of the systems presented here have more than one type of distance measurement. For example, a system with a trigonometric parallax published by our group is likely to also have a ccddist and a pltdist because we first estimated a distance photometrically from SuperCOSMOS plates, then measured V RI photometry to yield a more accurate ccddist, then observed the system for a parallax measurement, which provides trgdist. We rank the quality of the distances by the errors associated with each method: pltdists from photographic photometry rank third (errors at least 26%), ccddists from V RI photometry rank second (errors at least 15%), and trgdists derived from accurate trigonometric parallaxes are the best available (errors <5%). Figure 1 illustrates the distribution of all 1748 systems on the sky.

2.1. Multiples

We are currently involved in an all-sky study of the multiplicity of M dwarfs using a sample of ∼1300 red dwarfs having accurate trigonometric parallaxes placing them within 25 pc. This project involves three search methods to identify and confirm companions at separations from 0.1^{′′} to 600^{′′}: a robotic adaptive optics search (0.1–2^{′′}), an I-band imaging search (∼1–10^{′′}), and a common proper motion search (∼5–600^{′′}). Because most of these results will be published in a future paper, we give only the number of known components in each system in Table 1. An exhaustive literature search was not performed. Based on this cursory search, the number of known multiples in the 25 pc portion of the sample is 164, which results in a multiplicity fraction of 12%. This is one-half to one-third the value that is expected (Henry 1991; Fischer & Marcy 1992; Janson et al. 2012, 2014), so it is clear that more work is needed to determine the true multiplicity fraction of even the nearest M dwarfs. Of the 164 multiples, 114 have pltdists that are based on unresolved photometry. These are

4The term pltdist is used for the remainder of the paper to indicate a distance estimate that combines SuperCOSMOS plate B_J R_{59F} I_{IV N} and 2MASS JHK_s magnitudes, as discussed in § 4.1. The plate R_{59F} magnitude is the second, more recent R epoch measurement of the two available in the SuperCOSMOS Sky Survey. The term ccddist is used to indicate a distance estimate that combines CCD V_J R_{KC} I_{KC} and 2MASS JHK_s magnitudes, as discussed in §4.2. The term trgdist is used for those objects for which an accurate trigonometric parallax has been measured, as discussed in § 3.4.

– 6 –

typically multiples with magnitude differences at BRI ≲ 2 and with separations <4^{′′}. Of these 114 with pltdists, 96 systems have ccddists based on unresolved photometry because their separations are <1^{′′}. In addition, photometry from the SAAO extracted from the literature (references in §1) uses apertures 21–31^{′′} in diameter, so additional components have likely been included in the photometric values used to derive ccddists. The comprehensive survey of red dwarf multiplicity mentioned above constitutes a major fraction of the first author’s Ph.D. work, so a much more careful treatment of red dwarf multiples within 25 pc is forthcoming. For now, we note that the reader should be cautious when applying the pltdist or ccddist values given in Table 2 for multiple systems.

3. Data

3.1. B_J R_{59F} I_{IV N} Plate Photometry

Plate magnitudes from SuperCOSMOS are given in Table 1 for all but a few systems and are rounded to the nearest hundredth magnitude.^5 Errors are typically 0.3 mags for magnitudes fainter than 15, with larger errors for brighter objects due to systematic errors (Hambly et al. 2001). Derived pltdists in Table 2 for SCR discoveries have been previously presented in the TSN papers, but we provide 1457 new pltdists here for previously known objects. Additional SuperCOSMOS queries were recently done in an effort to provide as many pltdists as possible. Due to an improved SuperCOSMOS photometric calibration,^6 some magnitudes will be slightly different from those reported in previous papers in this series; the values presented here are preferred. In some cases, a match was not found because very red objects were not always recovered from the B plate, because of very high proper motion, or because of source mergers or corruption. All matches were visually confirmed and were doublechecked using the SuperCOSMOS proper motions and BRI magnitudes.

5The wavelength ranges for the B_J , R_{59F} , and I_{IV N} filters are 3950-5400Å, 5900-6900Å, and 7150-9000Å, respectively (Morgan 1995).

6The recommended access point for the current version of the photometrically calibrated SuperCOSMOS data is the SuperCOSMOS Science Archive, found at http://surveys.roe.ac.uk/ssa. Details of the photometric calibration procedure are available in the online documentation at http://surveys.roe.ac.uk/ssa/dboverview.html#mags.

– 7 –

3.2. V_J R_{KC} I_{KC} CCD Photometry

We have measured V RI photometry for 799 of the systems presented here as a part of our astrometry/photometry program, primarily at the CTIO/SMARTS 0.9m, with a few measurements from the CTIO/SMARTS 1.0m (see Jao et al. (2005); Henry et al. (2006) for details on the astrometry; see Winters et al. (2011) for details on the photometry). The observations were made between 1999 and 2013. The photometry was typically acquired for these nearby star candidates based upon pltdists from our SuperCOSMOS trawls or from other proper motion or photometric surveys such as those listed in §1.

All of our V RI data, given in Table 1, were reduced using IRAF and are on the Johnson- Kron-Cousins system.^7 Calibration frames taken at the beginnings of nights were used for typical bias subtraction and dome flat-fielding. Standard star fields from Graham (1982), Bessel (1990), and/or Landolt (1992, 2007, 2013) were observed multiple times each night in order to derive transformation equations and extinction curves. In order to match those used by Landolt, apertures 14^{′′} in diameter were used to determine the stellar fluxes, except in cases where close contaminating sources needed to be deblended. In these cases, smaller apertures were used and aperture corrections were applied. As outlined in Winters et al. (2011), photometric errors are typically 30 millimagnitudes (mmags) for the V -band and 20 mmags for both the R- and I-bands. Further details about the data reduction procedures, transformation equations, etc., can be found in Jao et al. (2005) and Winters et al. (2011).

An additional 369 primaries were found to have high quality optical photometry available from the literature, primarily from Bessell, Weis, and the SAAO group.^8 Among these, 214 already have parallaxes that place them within 25 pc, while an additional 109 have a ccddist that place them within 25 pc. The R and I photometric values from Weis have all been transformed to the Johnson-Kron-Cousins system via the color relations given in Bessell & Weis (1987) so that all V RI values in Table 1 are on the same photometric system. SOAR/SOI (SOAR Optical Imager) photometry from Dieterich et al. (2014) has also been converted to the Johnson-Kron-Cousin system using methods described in that paper.

A comparison of (V_{CCD} − K_s) versus (B_{plt} − K_s) for 1026 objects for which both plate B and CCD V photometry is available is shown in Figure 2. Known close binaries for which the photometry is blended have been omitted. A third order polynomial fit,

(V_J − K_s) = 4.939 − 1.174*(B_{plt} − K_s) + 0.256*(B_{plt} − K_s)^2 − 0.010*(B_{plt} − K_s)^3

7The central wavelengths for the V_J (old), V_J (new), R_{KC} , and I_{KC} filters are 5438Å, 5475Å, 6425Å, and 8075Å, respectively. See Jao et al. (2011) for a discussion of the nearly identical V_J (old) and V_J (new) filters.

8References given in Table 1.

– 8 –

permits users of SuperCOSMOS data to predict a CCD V_J magnitude from a given (B_{plt}−K_s) for red objects similar to those given in this paper, (V_J − K_s) = 3.5–9.27 or (B_{plt} − K_s) ≈ 3.7–10.7, assuming a 2MASS K_s magnitude is known.

3.3. JHK_s Photometry from 2MASS

Infrared photometry in the JHK_s (hereafter simply JHK) system has been extracted from 2MASS (Skrutskie et al. 2006) and is rounded to the nearest hundredth magnitude in Table 1. All magnitudes have been checked by eye. As described in §4, the same 2MASS photometry has been used for both the pltdists and the new ccddists presented here. Errors are typically less than 50 mmags. Exceptions are indicated in Table 1 as superscripts to the magnitudes.

3.4. Trigonometric Parallaxes

A total of 442 southern M dwarf systems have trigdists placing them within 25 pc; their weighted mean parallaxes and resulting distances are listed in Tables 1 and 2. These systems have been extracted from the new RECONS 25 Parsec Database that contains all stellar systems with published trigonometric parallaxes of at least 40 mas and with errors less than 10 mas. The RECONS group has published the only parallax for 147 (25%) of the 581 systems with parallaxes reported in this paper. Included in that 147 are 24 systems in the lower portions of Tables 1 and 2 that have parallaxes < 40 mas measured by RECONS — these were anticipated to be closer than 25 pc because of their pltdists and/or ccddists, but are now known to lie beyond 25 pc.

For all systems without parallaxes, a search of YPC and HIP was carried out in the event that a parallax < 40 mas already existed. A 30^′ search radius for YPC and a 5^′ search radius for HIP were used in sweeps for objects to compensate for high proper motions as well as poor coordinates, the latter being particularly important for the YPC. Possible matches were then confirmed or refuted by comparing identifiers, proper motions, and V magnitudes. Seven percent (114 systems) of the entire sample in this paper were discovered to have parallaxes < 40 mas in YPC and/or HIP. No other systematic literature search for stars with published parallaxes beyond 25 pc has yet been done beyond those using YPC and HIP.

– 9 –

4. Distances

4.1. Photographic Plate Distance Estimates

The pltdist estimates in Table 2 are calculated by combining SuperCOSMOS BRI photometry with 2MASS infrared photometry via a suite of 15 color-M_K relations using BRIJHK, as described in Hambly et al. (2004). The four relations M_K vs. B − R, J − H, J − K, and H − K have limited spans in color through the M dwarf sequence and are thus omitted. The pltdist estimate is considered reliable if the remaining 11 relations are applicable, i.e. if a star’s color falls within the range covered by the calibrations for single, main sequence stars. However, if a target star is blended with another source on one plate, up to five relations may drop out of the suite, yielding a less reliable pltdist based on 6– 10 relations. We consider six relations to be the minimum number acceptable for a pltdist because at least two of the three BRI magnitudes, combined with three 2MASS measurements, provide optical/infrared colors consistent with those of normal main sequence stars. A few stars in Table 2 have pltdists with fewer than six relations because plate magnitudes were extracted and distances estimated after it was known that V RI photometry and/or trigonometric parallaxes were available. Thus the new extractions of SuperCOSMOS data simply augment the sample and provide as many distances as possible for comparisons.

As described in Hambly et al. (2004), to estimate the reliability of the pltdists generated from the suite of relations, single, main sequence, M dwarfs with known trgdists were run back through the relations to derive representative errors. The mean offsets between the pltdists and trigdists were found to be 26%. In Table 2 we list the total errors that include this systematic value combined in quadrature with the standard deviation of the up to 11 individual distances computed for a given star.

4.2. CCD Distance Estimates

The ccddists in Table 2 are determined using a method similar to that used for the pltdists and are described in Henry et al. (2004). The difference is that we use more accurate CCD V RI magnitudes obtained at CTIO instead of plate magnitudes from SuperCOSMOS to determine the suite of color-M_K relations. Again, the maximum number of possible relations from the combination of V RIJHK magnitudes is 15, but in this case 12 relations yield useful results, as the color spreads in M_K vs. J − H, J − K, and H − K are limited and these relations are omitted from the suite. For stars with V RI from the literature rather than from our observing program, the ccddists were calculated using the same relation suite. All photometry is on the Johnson-Kron-Cousins system, and therefore the resulting ccddists

– 10 –

are all generated in a uniform fashion.

Similar to the pltdist, stars with all 12 relations have ccddists we deem reliable (assuming the stars are single and on the main sequence), and those with 7–11 relations we deem suspect because at least one magnitude and up to five relations have dropped out of the suite. Again, some stars in Table 2 have ccddists with fewer than six relations because V RI photometry was gathered and distances estimated after it was known that trigonometric parallaxes were available. Thus the new extractions of V RI data simply augment the sample and provide as many distances as possible for comparisons. As described in Henry et al. (2004), to estimate the reliability of the ccddists generated from the suite of relations, single, main sequence M dwarfs with known trgdists were run back through the relations to derive representative errors. The mean offsets between the ccddists and trigdists were found to be 15%. In Table 2 we list the total errors that include this systematic value combined in quadrature with the standard deviation of the up to 12 individual distances computed for a given star. Those objects with equal magnitude companions included in unresolved photometry will have distance estimates placing them too close by a factor of 1.4. Light from fainter companions will decrease this offset, whereas light from additional unresolved companions will increase this offset.

Table 2 provides the derived data, split into the 25 pc sample (top) and systems with best quality distances beyond 25 pc (bottom). Data listed include the name of the M dwarf primary, coordinates, information on the pltdists (the distance, the total error, number of relations), ccddists (the distance, the total error, number of relations), and trgdists (the distance from the weighted mean of published parallaxes, the weighted mean error, and the number of parallaxes used to generate the weighted mean). These empirical values are then followed by the most reliable distance and its type. Distances based upon blended photometry are given in square brackets. Distances for subdwarfs (both confirmed and candidates) are given in curly brackets and are typically closer than estimated.

4.3. Distance Comparisons

Figure 3 shows a comparison of the pltdists and ccddists for the 739 stars that have both BRI and V RI photometry placing them within 25 pc. Only those objects thought to be single have been plotted. Error bars on individual points are omitted for clarity, but can be found for individual systems in Table 2. Total errors are typically 32% in pltdist and 16% in ccddist, and include the computed systematic errors inherent to the two techniques (26% and 15% for pltdists and ccddists, respectively), and the standard deviations of the individual estimates for each star. Because estimates from individual relations in the suites are usually

– 11 –

quite consistent, the total errors are dominated by the adopted values for systematic errors. The dominant cause of the distance discrepancies is poor plate photometry compared to CCD photometry.

Figures 4 (343 systems) and 5 (337 systems) compare the pltdists and ccddists, respectively, to the available trgdists placing systems within 25 pc, again using only single objects. The average offsets are 24% for the pltdists and 17% for the ccddists,consistent with the 26% and 15% reported in Hambly et al. (2004) and Henry et al. (2004). The inherent spreads around the one-to-one lines in each plot have three causes: (1) errors in the photometry and parallaxes used to derive the relations and for the stars targeted here, (2) unresolved systems, and (3) cosmic scatter due to differences in stellar ages, compositions, and perhaps magnetic properties among the stars that are not taken into account by the color-magnitude relations. BRI photometry errors dominate the pltdist vs. trgdist offsets, while cosmic scatter dominates the ccddist vs. trgdist offsets because the V RI photometry and parallax errors are each only a few percent. The reduced scatter in Figure 5 again illustrates the value of obtaining accurate photometry, as the scatter has been reduced by roughly a factor of two. While it appears that the distances are more often underestimated than overestimated, this is a result of the presence of unresolved multiples and young objects in the sample.

5. Results

5.1. M Dwarfs, M Subdwarfs and M Giants

Before outlining the population results of this study, we must first verify that stars included in the final sample are, indeed, M dwarfs based on the photometry and parallaxes now available. Although our sample has been selected to include only stars with proper motions in excess of μ = 0.^{′′}18 yr^{−1}, a few giants might be included that have extraordinary space velocities, or more likely, have erroneous proper motions. For stars without parallaxes, we use several color-color diagrams to separate dwarfs from interloping giants — an example is shown in Figure 6, which plots (J − H) vs. (R − K). There are some objects in this sample that have a published trigonometric parallax, but for which reliable CCD V RI photometry does not yet exist. Those objects have been included on this plot using the plate R magnitude, rather than on the absolute-color diagram in Figure 7.

A small supplementary set of giants not in the M dwarf sample discussed here is included for comparison. These giants have been observed at the 0.9m using the same instrument configuration as for the dwarfs. Only those objects with 2MASS magnitude quality codes of AAA are used in Figure 6. While there appears to be some blending of giants and dwarfs in

– 12 –

the early M section of the plot ((R − K) ∼ 2.5-3.5 and (J − H) ∼0.7-0.8), it is unlikely that any of the presumed dwarfs with only a photometric distance estimate in that region will be giants, given the proper motion limit of this sample. It is notable that the giants separate very cleanly from the dwarfs redward of (R − K) ∼4. The V RIJHK photometry for these objects is listed in Table 3.

Four stars in this diagram are worthy of note. We have been following the initially very interesting target CD-32 16735 on our parallax program and have measured for it a preliminary parallax of −4.69 ± 3.88 mas, essentially zero within the errors. Thus, this object is most certainly a giant. Both L173-003 and GJ0552.1 are likely unresolved binaries with odd colors from an inspection of their SuperCOSMOS images (as equal luminosity binaries will appear normal on a color-color plot). A comparison of the two available distances for L173- 003 also indicates that it is an unresolved binary, as its pltdist (23.4 pc) is an underestimate of the true trgdist (47.9 pc). GJ0552.1 also has two distances available for comparison; however they are both photometric estimates that agree within the errors: pltdist = 13.2 ± 5.3 versus ccddist = 16.3 ± 3.9. HD320012 has only a pltdist, but has large H and K magnitude errors.

For the roughly one-third of systems with parallaxes, confirming that they are red dwarfs is straightforward using an empirical HR diagram. An example, using M_V vs. (V − K), is shown in Figure 7. The M dwarf sequence is well-defined, and there is a noticeable population of cool subdwarfs below the main sequence having (V − K) = 3.5–4.5. As is evident from this diagram, none of the stars with trigonometric parallaxes presented in this paper fall in the region where known giants are found, so we are confident that at least among the stars with parallaxes, there are no giants.

In Figure 8 we show a reduced proper motion diagram (Boyd et al. 2011b) to confirm the subdwarfs identified in Figure 7 and to find additional subdwarf candidates in the sample that do not have parallaxes. Note that because subdwarfs are found below the main sequence (contrary to the positions of young and multiple objects above the main sequence), their distances will be overestimated rather than underestimated. Distances for these objects have been enclosed in curly brackets in Table 2 to highlight this effect. In total, we have identified 24 red subdwarf candidate systems, listed in Table 4. Of these 24 candidates, 21 have parallaxes, three do not, and 18 are confirmed subdwarfs (LHS2852 is buried in the mass of clustered points). While LHS3528, LHS0284, and LHS0323 both appear in (or on the border of) the subdwarf region of Figure 8, they have been shown spectroscopically to be dwarfs (Hawley et al. 1996; Jao et al. 2011). LHS0110 and SSS1444-2019 have both been identified as candidates by others (Jao et al. 2011; Schilbach et al. 2009).

– 13 –

5.2. The Red Dwarf Population

Of the 1748 systems presented here, our best distance estimates place 1404 closer than 25 pc. Table 5 lists the distance statistics for the entire sample. Those primaries with distance underestimates due to blended photometry are given in brackets next to the numbers in the multiples column. The 344 systems beyond 25 pc were typically pushed over the horizon via new V RI and/or new parallax measurements, or are supplementary entries to the sample with new V RI photometry. Even if an updated and better quality distance has moved a system beyond 25 pc, it remains in the sample for distance comparison purposes.

This sample is of sufficient size to calculate “retention rates” for stars that were first estimated to be within defined distance limits via the two photometric distance estimating techniques.

For the 1512 primaries that have pltdists that place them within 25 pc, 417 now have a trigonometric parallax (π_{trig}) ≥ 40 milliarcseconds (mas), and 112 now have π_{trig} < 40 mas, resulting in a 78.8% likelihood that an object initially estimated to be within 25 pc will be found within 25 pc. For the 904 primaries with pltdists ≤ 20 pc, 379 now have π_{trig} ≥ 40 mas, and 67 now have π_{trig} < 40 mas, leading to a retention rate of 85.0%. Finally, for the 443 systems with pltdists ≤ 15 pc, 276 now have π_{trig} ≥ 40 mas, and 18 now have π_{trig} < 40 mas, giving a retention rate of 93.9%.

For the 896 primaries that have ccddists that place them within 25 pc, 402 now have π_{trig} ≥ 40 mas, and 32 now have π_{trig} < 40 mas, giving a retention rate of 92.6%. For the 664 primaries with ccddists ≤ 20 pc, 359 now have π_{trig} ≥ 40 mas, and 12 now have π_{trig} < 40 mas, leading to a retention rate of 96.8%. And for the 409 systems with ccddists ≤ 15 pc, 257 now have π_{trig} ≥ 40 mas, and 4 now have π_{trig} < 40 mas, resulting in a 98.5% likelihood that an object initially estimated to be within 15 pc will be found within 25 pc.

Thus, our photometric distance estimating techniques are successful in revealing red dwarfs within 25 pc 79–99% of the time, depending on which set of photometry is used and how restrictive the boundary is set. Even in the worst case, we are successful in nearly 4 out of 5 cases.

Figure 9 outlines the volume density of the southern M dwarfs within 25 pc, using the (V − K) color versus distance in ten equal volume shells to 25 pc.^9 We expect a uniform volume density to the 25 pc horizon, and that is now the case for red dwarfs with types

9For those ∼500 targets that lack a V_J magnitude, one has been estimated using the polynomial given in §3.2.

– 14 –

earlier than ∼M4. Although recent work by RECONS (Dieterich et al. 2014) has bolstered the number of the closest and reddest objects on this plot, the sample shows a classic observational bias for redder, i.e. intrinsically fainter stars that are underrepresented at larger distances. There are several reasons for the non-uniform distribution, including: (1) The reddest dwarfs with types later than M6 have simply been missed in various search efforts, including our SCR trawls, due to their intrinsic faintness. (2) Some of the currently known 25 pc members are hidden multiples — resolution of these multiples would move the points to larger distances if they have been placed in Figure 9 using pltdist or ccddist. (3) Some systems are likely among the ∼80 southern red dwarfs within 25 pc predicted to have μ < 0.^{′′}18 yr^{−1} by Riedel (2012). These have been excluded due to our proper motion cut-off. In fact, we currently have ∼40 stars on our parallax program with μ < 0.^{′′}18 yr^{−1} having preliminary parallaxes larger than 40 mas. (4) Finally, some red dwarfs are lurking in the Galactic plane, which has traditionally been avoided due to crowded fields, although this deficit is not likely to be significantly distance-dependent.

We can assess the incompleteness of the current sample by assuming that the 19 southern systems with M dwarf primaries found within 5 pc (Henry 2014) represent a complete sample and that the stellar density is constant to 25 pc. If so, we expect 2375 such systems within 25 pc in the southern sky. The histogram in Figure 10 plots the cumulative number of expected systems at distances to 25 pc as a solid line, with the dotted lines representing the Poisson errors. Here we have propagated the 23% error on the 19 systems within 5 pc to 25 pc, corresponding to an error of 546 systems in 2375. The histogram of systems outlined for the trigonometric sample is the starting point for systems we consider reliably within 25 pc. The histograms for the CCD and plate additions include only those systems with best distances that are “clean”, i.e. those that are for single stars based on current information, and that are not subdwarfs. These histograms are presumably overestimates, as a fraction of the included systems are as yet undiscovered close multiples with blended photometry whose plate and CCD distances are underestimates. We do not expect these overestimates to be extreme, in part because some of the known close multiple systems purposely removed to clean the sample will remain within 25 pc. With these caveats in mind, we make the following assessments of our current knowledge:

We predict that there are 1829–2921 stellar systems with red dwarf primaries within 25 pc in the southern sky.

We have identified roughly 1400 of these systems.

Based on our retention rates, only ∼90% of those with distance estimates or 1302 of these will remain within 25 pc.

– 15 –

There are ∼530–1620 systems missing from the current sample.

Using the mass-M_K relation given in Henry & McCarthy (1993), masses have been estimated for each M dwarf primary in the sample that is currently believed to be a single, main sequence star. The resulting mass function, the number of stars within each mass bin, for southern primaries within 25 pc is illustrated in Figure 11. The mass function may turn over at some point, but the turnover at ∼0.15M_⊙ indicated in this histogram is likely not the final answer. Early work by Henry & McCarthy (1990) pointed to ∼0.1 M_⊙ as the end of the main sequence and where the mass function will turn over. More recent work by Chabrier (2003) and Dieterich et al. (2012) reinforces this result. As is evident in Figure 9, few of the intrinsically faintest M dwarfs have yet to be identified beyond ∼20 pc, corresponding to roughly half of the sample volume, and these are the stars that will fill the lowest mass bins in Figure 11. Perhaps even more important, the true mass function for low mass stars will include M dwarfs as companions, and both known and as yet unknown fainter companions to M dwarf primaries in the sample will shift points to lower masses. This makes a profound statement that the smallest stars are the most likely product of the stellar/substellar formation process.

6. Future

Of the 1404 southern M dwarf systems presented here as within 25 pc, 954 do not have published parallaxes. More than 250 objects with only distances estimates are on our astrometry program at the 0.9m. If these systems lacking a parallax turn out to be within 25 pc, the RECONS effort in the southern sky will have increased the number of stellar systems identified within this distance by 52%.

Of course, Gaia should make great contributions to the census of nearby red dwarfs. However, assuming its V ≈ 20 limit (Sozzetti et al. 2014) is achieved, it will only reach the intrinsically faintest M dwarfs to about 10 pc. Thus, it appears that careful, pointed observations to reveal the M dwarfs within 25 pc remain warranted and will be crucial in determining the true mass function for the smallest stars.

7. Acknowledgments

This research was made possible by NSF grants AST-0908402 and AST-1109445. The support of additional RECONS team members was vital for this research. We also thank the members of the SMARTS Consortium, who enable the operations of the small telescopes

– 16 –

at CTIO, as well as the observer support at CTIO, specifically Edgardo Cosgrove, Arturo Gomez, Alberto Miranda, Joselino Vasquez, Mauricio Rojas, and Hernan Tirado. We would like to thank Rick Mascall for bringing to our attention the object OUT1720-1725. The authors are grateful to referee Bill van Altena for suggesting changes that improved the paper.

This research has made use of data obtained from the SuperCOSMOS Science Archive, prepared and hosted by the Wide Field Astronomy Unit, Institute for Astronomy, University of Edinburgh, which is funded by the UK Science and Technology Facilities Council. Data products from the Two Micron All Sky Survey, which is a joint project of the University of Massachusetts and the Infrared Processing and Analysis Center/California Institute of Technology, funded by the National Aeronautics and Space Administration and the National Science Foundation have also been used, as have the SIMBAD database and the Aladin and Vizier interfaces, operated at CDS, Strasbourg, France.

REFERENCES

Andrei, A. H., et al. 2011, AJ, 141, 54

Anglada-Escudé, G., Boss, A. P., Weinberger, A. J., Thompson, I. B., Butler, R. P., Vogt, S. S., & Rivera, E. J. 2012, ApJ, 746, 37

Benedict, G. F., et al. 2002, ApJ, 581, L115

Bessel, M. S. 1990, A&AS, 83, 357

Bessell, M. S. 1991, AJ, 101, 662

Bessell, M. S., & Weis, E. W. 1987, PASP, 99, 642

Biller, B. A., & Close, L. M. 2007, ApJ, 669, L41

Boyd, M. R., Henry, T. J., Jao, W.-C., Subasavage, J. P., & Hambly, N. C. 2011a, AJ, 142, 92 Boyd, M. R., Winters, J. G., Henry, T. J., Jao, W.-C., Finch, C. T., Subasavage, J. P., & Hambly, N. C. 2011b, AJ, 142, 10

Chabrier, G. 2003, PASP, 115, 763

Costa, E., & Méndez, R. A. 2003, A&A, 402, 541

– 17 –

Costa, E., Méndez, R. A., Jao, W.-C., Henry, T. J., Subasavage, J. P., Brown, M. A., Ianna, P. A., & Bartlett, J. 2005, AJ, 130, 337 Costa, E., Méndez, R. A., Jao, W.-C., Henry, T. J., Subasavage, J. P., & Ianna, P. A. 2006, AJ, 132, 1234 Deacon, N. R., & Hambly, N. C. 2001, A&A, 380, 148 —. 2007, A&A, 468, 163 Deacon, N. R., Hambly, N. C., & Cooke, J. A. 2005a, A&A, 435, 363 Deacon, N. R., Hambly, N. C., Henry, T. J., Subasavage, J. P., Brown, M. A., & Jao, W.-C.

2005b, AJ, 129, 409 Deacon, N. R., Hambly, N. C., King, R. R., & McCaughrean, M. J. 2009a, MNRAS, 394, 857 Deacon, N. R., et al. 2009b, MNRAS, 397, 1685 Dieterich, S. B., Henry, T. J., Golimowski, D. A., Krist, J. E., & Tanner, A. M. 2012, AJ, 144, 64 Dieterich, S. B., Henry, T. J., Jao, W.-C., Winters, J. G., Hosey, A. D., Riedel, A. R., & Subasavage, J. P. 2014, AJ, 147, 94 Dupuy, T. J., & Liu, M. C. 2012, ApJS, 201, 19 Fabricius, C., & Makarov, V. V. 2000, A&AS, 144, 45 Faherty, J. K., et al. 2012, ApJ, 752, 56 Finch, C. T., Henry, T. J., Subasavage, J. P., Jao, W.-C., & Hambly, N. C. 2007, AJ, 133, 2898 Finch, C. T., Zacharias, N., Boyd, M. R., Henry, T. J., & Hambly, N. C. 2012, ApJ, 745, 118 Finch, C. T., Zacharias, N., & Henry, T. J. 2010, AJ, 140, 844 Fischer, D. A., & Marcy, G. W. 1992, ApJ, 396, 178 Gatewood, G., Coban, L., & Han, I. 2003, AJ, 125, 1530

– 18 –

Giclas, H. L., Burnham, R., & Thomas, N. G. 1971, Lowell proper motion survey Northern Hemisphere. The G numbered stars. 8991 stars fainter than magnitude 8 with motions gt 0”.26/year (Lowell Observatory, Flagstaff, Arizona) Giclas, H. L., Burnham, Jr., R., & Thomas, N. G. 1978, Lowell Observatory Bulletin, 8, 89 Gizis, J. E. 1997, AJ, 113, 806 Gizis, J. E., Troup, N. W., & Burgasser, A. J. 2011, ApJ, 736, L34 Graham, J. A. 1982, PASP, 94, 244 Hambly, N. C., Henry, T. J., Subasavage, J. P., Brown, M. A., & Jao, W.-C. 2004, AJ, 128, 437 Hambly, N. C., Irwin, M. J., & MacGillivray, H. T. 2001, MNRAS, 326, 1295 Hawley, S. L., Gizis, J. E., & Reid, I. N. 1996, AJ, 112, 2799 Henry, T. J. 1991, PhD thesis, Arizona Univ., Tucson.

Henry, T. J. 2014, in The Observer’s Handbook, ed. D. M. F. Chapman (Toronto, Ontario:

The Royal Astronomical Society of Canada), 286–290 Henry, T. J., Ianna, P. A., Kirkpatrick, J. D., & Jahreiss, H. 1997, AJ, 114, 388 Henry, T. J., Jao, W.-C., Subasavage, J. P., Beaulieu, T. D., Ianna, P. A., Costa, E., & Méndez, R. A. 2006, AJ, 132, 2360 Henry, T. J., & McCarthy, Jr., D. W. 1990, ApJ, 350, 334 —. 1993, AJ, 106, 773 Henry, T. J., Subasavage, J. P., Brown, M. A., Beaulieu, T. D., Jao, W.-C., & Hambly, N. C. 2004, AJ, 128, 2460 Hershey, J. L., & Taff, L. G. 1998, AJ, 116, 1440 Høg, E., et al. 2000, A&A, 355, L27 Janson, M., Bergfors, C., Brandner, W., Kudryavtseva, N., Hormuth, F., Hippler, S., & Henning, T. 2014, ArXiv e-prints Janson, M., et al. 2012, ApJ, 754, 44

– 19 –

Jao, W.-C., Henry, T. J., Beaulieu, T. D., & Subasavage, J. P. 2008, AJ, 136, 840 Jao, W.-C., Henry, T. J., Subasavage, J. P., Brown, M. A., Ianna, P. A., Bartlett, J. L., Costa, E., & Méndez, R. A. 2005, AJ, 129, 1954 Jao, W.-C., Henry, T. J., Subasavage, J. P., Winters, J. G., Gies, D. R., Riedel, A. R., & Ianna, P. A. 2014, AJ, 147, 21 Jao, W.-C., Henry, T. J., Subasavage, J. P., Winters, J. G., Riedel, A. R., & Ianna, P. A.

2011, AJ, 141, 117 Kilkenny, D., & Cousins, A. W. J. 1995, Ap&SS, 230, 155 Kilkenny, D., Koen, C., van Wyk, F., Marang, F., & Cooper, D. 2007, MNRAS, 380, 1261 Kilkenny, D., van Wyk, F., Roberts, G., Marang, F., & Cooper, D. 1998, MNRAS, 294, 93 Koen, C., Kilkenny, D., van Wyk, F., Cooper, D., & Marang, F. 2002, MNRAS, 334, 20 Koen, C., Kilkenny, D., van Wyk, F., & Marang, F. 2010, MNRAS, 403, 1949 Landolt, A. U. 1992, AJ, 104, 372 —. 2007, AJ, 133, 2502 —. 2013, AJ, 146, 131 Lépine, S. 2005a, AJ, 130, 1680 —. 2005b, AJ, 130, 1247 —. 2008, AJ, 135, 2177 Lépine, S., & Gaidos, E. 2011, AJ, 142, 138 Lépine, S., Shara, M. M., & Rich, R. M. 2002, AJ, 124, 1190 —. 2003, AJ, 126, 921 Luyten, W. J. 1979a, LHS Catalogue. Second edition. (University of Minnesota) —. 1979b, NLTT catalogue. Volume I. +90 to +30 . Volume. II. +30 to 0 . (University of Minnesota) —. 1980a, NLTT Catalogue. Volume III. 0 to -30 . (University of Minnesota)

– 20 –

—. 1980b, NLTT Catalogue. Volume IV. -30 to -90 . (University of Minnesota) Mamajek, E. E., et al. 2013, AJ, 146, 154 Monet, D. G., et al. 2003, AJ, 125, 984 Morgan, D. H. 1995, in Astronomical Society of the Pacific Conference Series, Vol. 84, IAU Colloq. 148: The Future Utilisation of Schmidt Telescopes, ed. J. Chapman, R. Cannon, S. Harrison, & B. Hidayat, 137 Patterson, R. J., Ianna, P. A., & Begam, M. C. 1998, AJ, 115, 1648 Perryman, M. A. C., et al. 1997, A&A, 323, L49 Phan-Bao, N. 2011, Astronomische Nachrichten, 332, 668 Pokorny, R. S., Jones, H. R. A., & Hambly, N. C. 2003, A&A, 397, 575 Pokorny, R. S., Jones, H. R. A., Hambly, N. C., & Pinfield, D. J. 2004, A&A, 421, 763 Reid, I. N., & Gizis, J. E. 2005, PASP, 117, 676 Reid, I. N., Kilkenny, D., & Cruz, K. L. 2002, AJ, 123, 2822 Reid, I. N., van Wyk, F., Marang, F., Roberts, G., Kilkenny, D., & Mahoney, S. 2001, MNRAS, 325, 931 Reid, I. N., et al. 2003, AJ, 126, 3007 —. 2004, AJ, 128, 463 Riedel, A. R. 2012, PhD thesis, Georgia State University Riedel, A. R., Murphy, S. J., Henry, T. J., Melis, C., Jao, W.-C., & Subasavage, J. P. 2011, AJ, 142, 104 Riedel, A. R., et al. 2010, AJ, 140, 897 —. 2014, AJ, 147, 85 Ruiz, M. T., Takamiya, M. Y., Mendez, R., Maza, J., & Wishnjewsky, M. 1993, AJ, 106, 2575 Ruiz, M. T., Wischnjewsky, M., Rojo, P. M., & Gonzalez, L. E. 2001, ApJS, 133, 119 Schilbach, E., Röser, S., & Scholz, R.-D. 2009, A&A, 493, L27

– 21 –

Schmidt, S. J., Cruz, K. L., Bongiorno, B. J., Liebert, J., & Reid, I. N. 2007, AJ, 133, 2258 Scholz, R.-D., Lehmann, I., Matute, I., & Zinnecker, H. 2004, A&A, 425, 519 Shkolnik, E. L., Anglada-Escudé, G., Liu, M. C., Bowler, B. P., Weinberger, A. J., Boss, A. P., Reid, I. N., & Tamura, M. 2012, ApJ, 758, 56 Skrutskie, M. F., et al. 2006, AJ, 131, 1163 Smart, R. L., Ioannidis, G., Jones, H. R. A., Bucciarelli, B., & Lattanzi, M. G. 2010, A&A, 514, A84 Smart, R. L., Lattanzi, M. G., Jahreiß, H., Bucciarelli, B., & Massone, G. 2007, A&A, 464, 787 Söderhjelm, S. 1999, A&A, 341, 121 Sozzetti, A., Giacobbe, P., Lattanzi, M. G., Micela, G., Morbidelli, R., & Tinetti, G. 2014, MNRAS, 437, 497 Subasavage, J. P., Henry, T. J., Hambly, N. C., Brown, M. A., & Jao, W.-C. 2005a, AJ, 129, 413 Subasavage, J. P., Henry, T. J., Hambly, N. C., Brown, M. A., Jao, W.-C., & Finch, C. T.

2005b, AJ, 130, 1658 Subasavage, J. P., Jao, W.-C., Henry, T. J., Bergeron, P., Dufour, P., Ianna, P. A., Costa, E., & Méndez, R. A. 2009, AJ, 137, 4547 Tinney, C. G. 1996, MNRAS, 281, 644 Tinney, C. G., Reid, I. N., Gizis, J., & Mould, J. R. 1995, AJ, 110, 3014 van Altena, W. F., Lee, J. T., & Hoffleit, D. 1995, VizieR Online Data Catalog, 1174, 0 van Leeuwen, F., ed. 2007, Astrophysics and Space Science Library, Vol. 350, Hipparcos, the New Reduction of the Raw Data von Braun, K., et al. 2011, ApJ, 729, L26 Weis, E. W. 1984, ApJS, 55, 289 —. 1986, AJ, 91, 626 —. 1987, AJ, 93, 451

– 22 –

—. 1988, Ap&SS, 142, 223 —. 1991a, AJ, 102, 1795 —. 1991b, AJ, 101, 1882 —. 1993, AJ, 105, 1962 —. 1994, AJ, 107, 1135 —. 1996, AJ, 112, 2300 —. 1999, AJ, 117, 3021 Winters, J. G., Henry, T. J., Jao, W.-C., Subasavage, J. P., Finch, C. T., & Hambly, N. C.

2011, AJ, 141, 21 Wolf, M., & Reinmuth, K. 1925, Astronomische Nachrichten, 223, 231 Wroblewski, H., & Costa, E. 1999, A&AS, 139, 25 —. 2000, A&AS, 142, 369 —. 2001, A&A, 367, 725 Wroblewski, H., & Torres, C. 1989, A&AS, 78, 231 —. 1990, A&AS, 83, 317 —. 1991, A&AS, 91, 129 —. 1992, A&AS, 92, 449 —. 1994, A&AS, 105, 179 —. 1995, A&AS, 110, 27 —. 1996, A&AS, 115, 481 —. 1997, A&AS, 122, 447 —. 1998, A&AS, 128, 457

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 23 –

Fig. 1.— Distribution of the entire sample of 1748 M dwarf systems on the southern sky in RA and DEC. Solid points indicate the 1404 systems within 25 pc, while open points indicate the 344 systems beyond 25 pc. The Galactic plane has been plotted in gray.

– 24 –

Fig. 2.— Comparison of the CCD (V − K) color to the plate (B − K) color for more than 1000 objects. Known multiples with blended photometry are not included. The dashed line indicates a third order polynomial fit (given in §3.2) that provides an estimated CCD V magnitude, given a measured plate B magnitude for red objects and a known 2MASS K magnitude.

– 25 –

Fig. 3.— Distance comparisons of estimates using photographic plate photometry (pltdist) vs. CCD photometry (ccddist) for the systems closer than 25 pc that have both BRI and V RI photometry. Known unresolved multiples with blended photometry were not included. The diagonal line represents 1:1 correspondence in distances, while the dashed lines indicate the 26% errors associated with the plate distance estimates.

– 26 –

Fig. 4.— Distance comparisons of estimates from photographic plate photometry (pltdist) vs. distances measured using trigonometric parallaxes (trgdist) for the systems closer than 25 pc. Known unresolved multiples with blended photometry were not included. The diagonal line represents 1:1 correspondence in distances, while the dashed lines indicate the 26% errors associated with the plate distance estimates. The inset histogram indicates the distribution of the distance offsets between the pltdist and trgdist. For this sample, the absolute mean offset is 24%, consistent with the 26% systematic error determined in Hambly et al. (2004).

– 27 –

Fig. 5.— Distance comparisons of estimates from CCD photometry (ccddist) vs. distances measured using trigonometric parallaxes (trgdist) for the systems closer than 25 pc. Known unresolved multiples with blended photometry were not included. The diagonal line represents 1:1 correspondence in distances, while the dashed lines indicate the 15% errors associated with the CCD distance estimates. Note the reduced scatter compared to the similar pltdist plot shown in Figure 4, indicating the improvement in the photometry. The inset histogram indicates the distribution of the distance offsets between the pltdist and trgdist. For this sample, the absolute mean offset is 17%, consistent with the 15% systematic error determined by Henry et al. (2004).

– 28 –

Fig. 6.— Color-color diagram showing (J −H) vs. (R−K) for all presumed single M dwarfs in the sample. Known unresolved multiples with blended photometry were not included. Colors that use plate R magnitudes are shown as x’s, while those that use CCD R magnitudes are plotted as plusses. Plate R photometry is used to calculate colors for the objects for which a published parallax, but no CCD R photometry exists and are noted as asterisks with a solid center. For comparison, a few known giants are denoted by open circles. The object CD-32 16735 is plotted as a solid dot surrounded by an open circle, as it is surely a giant, given its preliminary parallax. The giant X Men is too red for the (R − K) color cut-off of this plot, but has been indicated with an arrow. Corresponding spectral type estimates are given along the bottom.

– 29 –

Fig. 7.— An observational HR diagram for all M dwarf systems in the sample that have trigonometric parallaxes and V magnitudes, using M_V and (V −K) as proxies for luminosity and temperature, respectively. Known multiples with blended photometry are enclosed in open squares. A set of a few dozen subdwarfs is evident below the main sequence. Spectroscopically confirmed subdwarfs have been enclosed in triangles, with references given in Table 3. Corresponding spectral type estimates are given along the bottom.

– 30 –

Fig. 8.— A reduced proper motion diagram is shown, which is used to separate the dwarfs from the subdwarfs in the entire sample, based on the proper motion of the objects. The region of interest is outlined, as in Boyd et al. (2011b). The y-axis is H_R = R + 5 + 5log (μ) and the x-axis is the (R − J) color. Primaries with trgdists are plotted as solid dots, those with ccddists are plusses, and those with pltdists are x’s. Objects that have a published parallax, but no CCD photometry have been indicated as asterisks with a solid center. Three additional objects, among those identified as subdwarf candidates in Table 4, are shown inside the outlined subdwarf region: LHS0284, LHS0323, and LEHPM1-4592, although both LHS0284 and LHS0323 have been shown to be dwarfs (Jao et al. (2011)). Spectroscopically confirmed subdwarfs have been enclosed in triangles, three of which fall outside the indicated subdwarf region and are labeled. Corresponding spectral type estimates are given along the bottom.

– 31 –

Fig. 9.— The density of M dwarf systems in the southern sky is plotted using (V − K) vs. distance in 10 equal-volume shells to 25 pc . Solid points indicate systems with trgdists, plusses indicate those with ccddists, and x’s indicate those with pltdists. Corresponding spectral type estimates are given along the right. For those 507 objects without a CCD V magnitude, one has been estimated using the equation in §3.2. The horizontal lines highlight masses of 0.60, 0.30, and 0.10 M_⊙ from top to bottom.

– 32 –

Fig. 10.— The cumulative numbers of southern single M dwarf systems known via the three distance techniques described in this paper are shown using histograms. Those objects with trgdists are indicated with vertical hatching, those with ccddists have −45 degree hatching and those with pltdists have +45 degree hatching. The solid black curve indicates the expected number within that distance horizon based on the 19 southern M dwarf systems known to lie within 5 pc with accurate trigonometric parallaxes and assuming a uniform density to 25 pc. The dotted lines indicate the extrapolated 23% Poisson errors based on those 19 systems.

– 33 –

Fig. 11.— The mass function for southern single M dwarf primaries known within 25 pc is shown. Not included are the 100 primaries with blended photometry due to the presence of a close companion. Those objects with mass estimates greater than 0.6 M_⊙ are possibly unknown unresolved close multiples. The apparent turnover at ∼0.15 M_⊙ is likely not the final answer.

– 34 –

Table 1. Observed Data for Southern Red Dwarf Systems

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

2MA0000-1245 1 00 00 28.7 −12 45 16 0.191 228.6 41 ... ... ... ... ... 19.26 15.88 20.78 18.71 16.27 1/ 13.20 12.45 11.97 LTT09844 1 00 00 46.9 −35 10 06 0.403 106.3 1 ... ... ... ... 13.48 11.30 10.21 ... ... ... ... 9.12 8.48 8.28 GJ1001 3(1) 00 04 36.5 −40 44 03 1.636 159.7 1 .07987 .00375 2 25,63 14.21 11.83 10.06 12.83 11.62 10.08 4/25u 8.60 8.04 7.74 G158-025 1 00 04 40.3 −09 52 42 0.267 170.6 1 ... ... ... ... 14.47 12.52 10.92 ... ... ... ... 9.77 9.10 8.82 SIP0004-2058 1 00 04 41.5 −20 58 30 0.826 090.6 1 ... ... ... ... 21.86 18.85 15.65 19.94 17.81 15.36 2/ 12.40 11.83 11.40 GJ0001 1 00 05 24.4 −37 21 27 6.106 112.5 28 .23032 .00090 2 63,64 10.10 7.91 6.28 8.54 7.57 6.41 /5 5.33 4.83c 4.52 LP644-034 1 00 05 34.9 −06 07 07 0.218 111.7 1 ... ... ... ... 13.85 11.75 9.92 ... ... ... ... 9.26 8.65 8.41 LP644-039 1 00 06 13.1 −02 32 11 0.305 101.3 1 ... ... ... ... 15.38 13.34 10.91 14.62 13.42 11.84 /45 10.22 9.60 9.30 LHS1019 1 00 06 19.2 −65 50 26 0.564 158.7 1 .05985 .00264 1 64 13.13 10.92 8.98 12.17 11.11 9.78 /34 8.48 7.84 7.63 GJ1002 1 00 06 43.2 −07 32 17 2.041 204.0 63 .21300 .00360 1 63 15.04 12.34 9.88 13.84 12.21 10.21 3/ 8.32 7.79 7.44 L217-028 1 00 08 17.4 −57 05 53 0.370 264.0 38 ... ... ... ... 12.20 10.22 9.30 12.13 11.00 9.57 3/ 8.21 7.63 7.40 GJ0007 1 00 09 04.3 −27 07 20 0.715 079.7 1 .04361 .00256 2 63,64 12.52 10.13 9.11 11.69 10.74 9.79 /5 8.66 8.14 7.86 LP644-094 1 00 09 13.5 −04 08 02 0.190 243.1 1 ... ... ... ... 12.60 10.75 9.04 12.03 11.01 9.80 /46 8.58 7.98 7.73 BPM46052 1 00 09 20.0 −21 14 41 0.186 125.1 1 ... ... ... ... 13.50 11.75 9.89 ... ... ... ... 8.76 8.16 7.94 LEHPM1-0254 1 00 09 43.3 −41 17 36 0.226 067.9 1 ... ... ... ... 17.24 15.01 12.89 ... ... ... ... 10.92 10.38 10.08 LEHPM1-0255 1 00 09 45.1 −42 01 40 0.271 096.7 1 ... ... ... ... 15.17 13.01 10.68 13.62 12.35 10.66 3/ 9.07 8.45 8.22 L217-009 1 00 11 49.1 −55 21 52 0.362 218.2 1 ... ... ... ... 13.99 11.93 11.04 ... ... ... ... 9.33 8.72 8.50 GJ1005 2 00 15 28.1 −16 08 02 0.842 132.4 57 .16842 .00089 4 27,57,58,63 12.24J 9.96J 8.07J 11.48J 10.27J 8.70J 3/ 7.22J 6.71J 6.39J LHS1051 2(1) 00 15 51.5 −67 59 52 0.562 105.7 1 ... ... ... ... 12.01 9.72 8.57 10.90 9.94 8.91 1/ 7.80 7.21 6.95 L290-072 2 00 16 02.0 −48 15 39 0.244 190.9 1 .04389 .00439 1 64 12.08J 9.85J 8.58J 11.55J 10.51J 9.24J /34 7.97J 7.36J 7.11J L218-009 1 00 16 36.6 −50 16 09 0.432 052.2 1 .04504 .00336 1 64 13.01 10.54 9.26 12.35 11.34 10.14 /34 8.97 8.33 8.17 SCR0017-3219 1 00 17 15.7 −32 19 54 0.220 096.9 1 ... ... ... ... 16.80 14.59 12.48 15.45 14.11 12.39 /71 10.64 10.08 9.73 LP704-074 1 00 17 28.2 −08 44 23 0.388 107.0 37 ... ... ... ... 13.63 11.64 10.05 ... ... ... ... 9.16 8.60 8.36 LTT00139 1 00 17 40.7 −01 22 41 0.393 090.8 1 ... ... ... ... 13.96 11.92 10.26 12.89 11.84 10.50 /45 9.24 8.57 8.36 LTT00151 1 00 18 44.8 −34 50 15 0.275 183.7 1 ... ... ... ... 14.14 11.92 10.49 ... ... ... ... 9.02 8.39 8.16 LP825-035 1 00 20 23.2 −23 46 05 0.338 102.8 1 ... ... ... ... 20.19 17.84 14.83 ... ... ... ... 12.35 11.72 11.34 L170-007 1 00 20 41.5 −53 40 54 0.406 092.1 1 ... ... ... ... 14.54 12.40 10.68 ... ... ... ... 9.68 9.10 8.81 GJ0017.1 1 00 21 19.6 −45 44 47 0.854 179.8 1 .05776 .00192 2 63,64 11.37 8.87 7.88 10.40 9.46 8.50 /5 7.41 6.81 6.54 LHS5004a 1 00 21 37.3 −46 05 33 0.442 218.1 1 .05180 .00440 1 64 13.18 10.60 9.16 12.24 11.14 9.73 /34 8.33 7.73 7.45 LTT00180 1 00 21 39.4 −09 00 25 0.283 221.2 1 ... ... ... ... 15.07 12.95 11.25 13.94 12.76 11.24 /45 9.71 9.15 8.87 G158-066 1 00 21 53.4 −09 38 03 0.417 087.1 1 ... ... ... ... 14.04 12.02 10.64 ... ... ... ... 9.46 8.78c 8.57 L086-082 1 00 21 54.9 −68 31 26 0.253 197.8 1 ... ... ... ... 12.38 9.76 8.86 11.13 10.21 9.26 /46 8.23 7.59 7.35 GJ1009 1 00 21 56.1 −31 24 22 0.223 165.9 1 .05562 .00232 1 64 12.19 9.90 8.85 11.13 10.12 8.92 /34 7.67 7.05 6.79 L026-099 1 00 22 27.1 −79 09 59 0.255 084.9 1 ... ... ... ... 12.18 10.21 8.68 ... ... ... ... 8.45 7.84 7.62 LHS1064 1 00 23 18.5 −50 53 38 0.570 090.6 1 .04995 .00271 2 63,64 13.10 10.94 9.30 11.89 10.84 9.56 /34 8.26 7.64 7.38 LTT00214 1 00 24 25.2 −12 17 25 0.311 086.2 1 ... ... ... ... 12.82 10.66 9.28 12.25 11.23 10.02 /45 8.83 8.21 7.98 GJ2005 3 00 24 44.2 −27 08 24 0.654 348.3 10 .12971 .00243 2 10,63 17.03J 14.42J 11.46J 15.28J 13.52J 11.37J 5/ 9.25J 8.55J 8.24J LTT00220 1 00 25 04.3 −36 46 18 0.272 076.9 1 ... ... ... ... 13.80 11.53 10.13 12.48 11.38 10.00 2/ 8.65 8.04 7.83 SCR0027-0806 1 00 27 45.4 −08 06 05 0.184 122.3 1 ... ... ... ... 18.65 16.26 13.49 17.51 15.83 13.72 /71 11.57 10.97 10.61 LTT00250 2(1) 00 28 05.0 −23 00 37 0.325 164.0 1 ... ... ... ... 15.12 13.11 11.31 ... ... ... ... 9.93 9.27 9.07 GJ1012 1 00 28 39.5 −06 39 49 0.870 202.0 63 .07540 .00510 1 63 13.20 11.26 8.54 12.17 11.01 9.50 /69 8.04 7.50c 7.19 LEHPM1-0640 1 00 28 54.8 −27 33 34 0.199 073.9 1 ... ... ... ... 16.65 14.56 12.47 ... ... ... ... 10.76 10.15 9.90 LTT17138 1 00 28 57.7 −02 26 59 0.316 115.9 1 ... ... ... ... 14.27 12.23 10.10 ... ... ... ... 9.53 8.92 8.67 LTT00266 1 00 29 58.7 −24 38 27 0.392 080.6 1 ... ... ... ... 13.93 11.49 10.28 ... ... ... ... 9.16 8.56 8.28 L050-078 1 00 31 04.3 −72 01 06 0.435 068.7 1 ... ... ... ... 15.25 13.21 11.41 13.69 12.47 10.90 /46 9.37 8.75 8.45 GJ1013 1 00 31 35.4 −05 52 13 1.098 163.0 63 .06230 .00420 1 63 13.77 11.59 9.59 12.73 11.59 10.14 /69 8.76 8.22 7.95 GR0050 1 00 32 53.2 −04 34 07 0.186 155.4 1 ... ... ... ... 15.32 13.16 10.86 13.97 12.68 11.00 2/ 9.28 8.62 8.35 L291-115 1 00 33 13.5 −47 33 17 0.313 064.3 1 ... ... ... ... 16.96 14.62 11.97 ... ... ... ... 10.45 9.83 9.54 LHS1099 1 00 34 07.5 −23 03 19 0.613 083.6 1 ... ... ... ... 14.98 12.65 11.23 ... ... ... ... 9.89 9.28 9.03

– 35 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LTT00307 1 00 34 39.0 −02 25 00 0.268 084.8 1 ... ... ... ... 13.26 10.91 9.74 11.95 10.95 9.79 /45 8.57 7.95 7.69 LTT00313 1 00 35 38.1 −10 04 19 0.193 250.6 1 ... ... ... ... 13.01 11.05 9.33 11.85 10.81 9.57 3/ 8.33 7.74 7.48 LP645-053 1 00 35 44.1 −05 41 11 0.297 181.8 1 ... ... ... ... 17.35 15.09 12.74 ... ... ... ... 10.67 10.07 9.71 LP881-239 1 00 37 35.8 −27 08 31 0.180 126.7 1 ... ... ... ... 15.57 13.50 11.12 14.32 13.13 11.58 /46 10.03 9.46 9.18 LTT00338 1 00 38 33.4 −11 16 03 0.268 129.7 1 ... ... ... ... 13.63 11.61 10.36 ... ... ... ... 9.35 8.68 8.44 GJ0027.1 1 00 39 58.8 −44 15 12 0.535 114.6 28 .04099 .00270 2 63,64 12.29 9.87 8.92 11.39 10.44 9.36 /5 8.23 7.61 7.39 LTT00349 1 00 39 59.4 −12 11 43 0.265 089.8 1 ... ... ... ... 13.61 11.53 9.86 ... ... ... ... 9.14 8.58 8.23 GJ1016 1 00 41 30.5 −33 37 32 0.452 234.8 1 .05121 .00223 1 64 10.99 8.86 8.14 10.53 9.62 8.74 /34 7.71 7.10 6.88 LHS1134 1 00 43 26.0 −41 17 34 0.738 217.1 1 ... ... ... ... 14.26 12.09 9.82 13.00 11.75 10.11 2/ 8.57 8.03 7.71 LEHPM1-0927 1 00 44 38.0 −78 45 09 0.478 064.1 1 ... ... ... ... 18.87 16.59 13.10 ... ... ... ... 11.37 10.74 10.37 LHS1140 1 00 44 59.3 −15 16 18 0.625 153.0 1 ... ... ... ... 14.98 12.48 10.03 14.18 12.88 11.19 2/ 9.61 9.09 8.82 LP989-200 1 00 46 16.3 −40 17 54 0.403 075.7 1 ... ... ... ... 14.58 12.49 10.76 ... ... ... ... 9.64 9.05 8.77 LP646-016 1 00 47 18.0 −06 28 38 0.374 215.0 1 ... ... ... ... 15.32 13.37 11.43 ... ... ... ... 10.07 9.50 9.21 LTT00453 1 00 48 13.4 −05 08 08 0.218 125.8 1 .04207 .00376 1 64 13.32 10.86 9.89 12.04 11.04 9.94 1/ 8.77 8.18 7.93 LTT00464 1 00 49 01.7 −50 08 42 0.340 133.2 1 .04632 .00208 1 64 11.39 9.58 7.83 10.73 9.80 8.86 /34 7.80 7.16 6.95 GJ1022 1 00 49 29.1 −61 02 33 1.143 093.5 1 .04862 .00139 1 30 13.10 10.78 9.19 12.17 11.12 9.86 /30 8.63 8.09 7.84 LTT00534 1 00 56 50.4 −11 35 20 0.324 223.4 1 .04037 .00281 1 64 11.28 9.52 8.10 11.12 10.19 9.25 /34 8.23 7.60c 7.36 L087-002 1 00 57 12.5 −64 15 24 0.391 066.6 1 ... ... ... ... 13.57 11.28 9.64 12.40 11.28 9.81 4/ 8.40 7.82 7.60 GJ0046 1 00 58 27.9 −27 51 25 1.339 105.0 1 .08075 .00313 2 63,64 13.39 11.69 9.31 11.77 10.65 9.17 /5 7.76 7.20c 6.89 LTT00556 1 00 58 52.8 −28 13 52 0.333 075.0 1 ... ... ... ... 15.39 13.61 11.65 ... ... ... ... 9.95 9.35 9.07 GJ1025 1 01 00 56.1 −04 26 57 1.350 069.0 1 .08770 .00238 1 29 14.46 12.02 10.21 13.35 12.08 10.52 /29 9.04 8.49 8.22 LEP0100-7904 1 01 00 56.4 −79 04 25 0.379 215.3 1 ... ... ... ... 13.70 11.70 9.98 12.46 11.41 10.08 3/ 8.80 8.17 7.88 LTT00573 1 01 01 24.7 −01 05 59 0.301 104.1 1 ... ... ... ... 14.67 12.40 10.45 13.39 12.21 10.62 /45 9.27 8.63 8.37 L171-012 1 01 01 57.9 −55 23 46 0.283 075.6 1 ... ... ... ... 15.34 13.33 11.24 ... ... ... ... 10.01 9.47 9.17 LHS0132 1 01 02 51.1 −37 37 44 1.493 082.2 1 .08195 .00273 1 10 19.82 17.24 13.81 18.53 16.30 13.88 /16 11.13 10.48 10.07 LEHPM1-1188 1 01 03 12.0 −53 51 43 0.222 203.2 1 ... ... ... ... 19.91 17.40 14.64 ... ... ... ... 12.21 11.55 11.20 LTT00597 1 01 03 54.8 −26 20 05 0.390 165.4 1 ... ... ... ... 14.28 12.07 10.44 ... ... ... ... 9.40 8.85 8.56 L087-010 1 01 04 07.0 −65 22 27 0.343 239.1 1 ... ... ... ... 15.20 12.89 10.74 13.98 12.63 10.95 3/ 9.40 8.84 8.53 G269-089 1 01 04 28.9 −38 27 49 0.186 179.7 1 ... ... ... ... 14.09 12.13 10.05 ... ... ... ... 9.00 8.36 8.14 GJ1028 1 01 04 53.8 −18 07 29 1.342 071.0 63 .09980 .00500 1 63 15.51 13.33 10.85 14.45 12.99 11.13 /69 9.39 8.75 8.45 LTT00622 1 01 06 27.1 −02 10 35 0.470 131.4 1 ... ... ... ... 14.16 12.28 10.52 ... ... ... ... 9.59 8.93 8.71 GJ1031 1 01 08 18.3 −28 48 21 0.728 103.6 1 ... ... ... ... 14.55 12.18 10.22 ... ... ... ... 9.09 8.54 8.23 G271-001 1 01 08 50.4 −03 40 34 0.289 084.0 37 ... ... ... ... 14.51 12.63 10.58 ... ... ... ... 9.52 8.89 8.62 SSS0109-5101 1 01 09 01.5 −51 00 50 0.224 067.3 1 ... ... ... ... 21.19 18.31 14.78 20.17 17.55 15.11 2/ 12.23 11.54 11.09 GJ1032 1 01 09 12.5 −24 41 21 0.301 090.4 1 .04429 .00302 1 64 13.19 11.06 9.52 12.25 11.17 9.80 /34 8.45 7.84 7.61 GJ2021 1 01 09 18.7 −24 30 24 0.337 126.5 1 ... ... ... ... 15.78 13.47 11.37 ... ... ... ... 9.94 9.39 9.07 LP647-013 1 01 09 51.2 −03 43 26 0.376 086.6 1 .10423 .00229 1 10 21.10 17.94 14.77 19.31 17.14 14.88 3/ 11.69 10.93 10.43 LP707-016 1 01 10 17.5 −11 51 18 0.236 119.0 37 ... ... ... ... 13.00 10.87 8.68 12.70 11.50 10.02 2/ 8.63 7.93 7.66 GJ0054 2 01 10 22.9 −67 26 42 0.697 033.7 28 .12824 .00193 3 25,63,64 11.64J 8.38J 7.77J 9.82J 8.70J 7.32J /25 6.00J 5.41J 5.13J SCR0111-4908 1 01 11 47.5 −49 08 09 0.542 213.1 1 ... ... ... ... 18.93 16.50 13.01 17.72 15.92 13.75 /71 11.54 11.00 10.61 GJ0054.1 1 01 12 30.7 −16 59 56 1.386 063.6 1 .26908 .00299 2 63,64 13.08 10.56 8.52 12.15 10.72 8.94 1/ 7.26 6.75 6.42 LEHPM1-1343 1 01 13 16.4 −54 29 14 0.369 070.2 1 ... ... ... ... 15.39 13.45 10.99 14.16 12.85 11.17 2/ 9.57 8.98 8.68 SCR0113-7603 1 01 13 31.5 −76 03 09 0.228 125.1 1 ... ... ... ... 17.68 15.23 13.05 16.07 14.62 12.83 /71 11.03 10.47 10.13 LHS1217 1 01 14 08.6 −36 56 43 0.773 062.3 1 ... ... ... ... 15.11 12.99 11.23 ... ... ... ... 9.63 9.07 8.81 L221-060 1 01 14 34.2 −53 56 32 0.340 020.0 1 .06038 .00181 1 64 12.21 9.95 8.60 11.08 10.09 8.99 /34 7.81 7.24 6.97 LP938-144 1 01 14 36.7 −34 34 51 0.312 080.4 1 ... ... ... ... 17.13 15.03 12.86 ... ... ... ... 10.96 10.36 10.07 LP938-149 1 01 15 29.8 −33 25 52 0.244 192.0 1 ... ... ... ... 17.14 14.99 12.69 ... ... ... ... 10.95 10.37 10.06 GJ1036 1 01 17 15.4 −35 42 57 0.197 152.7 1 .06168 .00343 1 64 12.68 10.18 9.09 11.28 10.26 9.05 /34 7.85 7.18c 6.94 L797-030 1 01 17 15.7 −13 15 48 0.368 086.9 28 .04278 .00255 1 64 11.33 9.09 7.63 10.79 9.84 8.86 /34 7.76 7.17 6.91

– 36 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

GJ0056.1 1 01 18 16.0 −12 53 59 0.722 165.5 1 .04528 .00327 2 63,64 12.33 9.97 8.49 11.79 10.78 9.55 /5 8.36 7.74 7.55 LTT00734 1 01 19 51.1 −27 26 39 0.369 100.8 1 ... ... ... ... 15.47 13.11 11.32 ... ... ... ... 9.98 9.36 9.10 GJ0057 1 01 21 34.6 −41 39 23 1.279 112.5 1 .05990 .00153 2 63,64 11.06 9.33 7.97 10.12 9.25 8.38 /5 7.36 6.76 6.58 LTT00755 1 01 22 23.1 −33 12 51 0.470 130.7 1 .04066 .00185 1 64 11.67 9.33 8.93 ... ... ... ... 7.79 7.18 6.98 L797-023 1 01 23 18.0 −12 56 23 0.313 001.5 1 ... ... ... ... 13.74 11.34 9.67 12.99 11.88 10.49 2/ 9.18 8.63c 8.35 LTT00774 1 01 23 24.8 −30 45 34 0.236 213.2 1 ... ... ... ... 13.05 10.86 9.86 ... ... ... ... 8.62 8.03 7.82 SCR0124-0027 1 01 24 31.3 −00 27 56 0.193 155.9 1 ... ... ... ... 19.46 16.93 13.94 18.38 16.48 14.37 1/ 12.11 11.51 11.13 LEHPM1-1550 1 01 26 43.1 −54 43 30 0.300 091.7 1 ... ... ... ... 17.27 15.10 12.74 ... ... ... ... 10.87 10.24 9.95 L002-060 1 01 29 20.9 −85 56 11 0.431 137.9 1 ... ... ... ... 14.53 12.59 10.46 13.49 12.21 10.58 2/ 9.05 8.39 8.08 LTT00818 1 01 30 05.1 −25 45 08 0.321 096.2 1 ... ... ... ... 12.76 10.68 9.38 ... ... ... ... 8.66 7.97 7.79 LHS0142 1 01 32 26.2 −21 54 19 1.050 212.2 1 .05518 .00188 2 63,64 11.64 9.51 8.11 11.18 10.18 9.08 1/ 7.98 7.35 7.10 LP768-113 1 01 33 58.0 −17 38 24 0.190 167.5 1 ... ... ... ... 13.56 11.27 9.35 13.04 11.85 10.31 2/ 8.84 8.24 7.97 SCR0135-6127 1 01 35 53.7 −61 27 11 0.274 258.9 1 ... ... ... ... 15.01 12.83 10.96 14.32 13.11 11.57 /71 10.06 9.53 9.24 LP883-537 1 01 36 08.7 −26 52 16 0.229 098.4 1 ... ... ... ... 14.28 12.08 10.25 13.22 12.10 10.62 1/ 9.22 8.60 8.41 LP648-020 1 01 36 55.2 −06 47 38 0.214 124.0 1 ... ... ... ... 14.87 12.54 10.40 ... ... ... ... 9.71 9.14 8.86 LHS1268 1 01 37 20.8 −49 11 44 0.509 076.7 28 .04438 .00149 2 63,64 11.35 9.23 8.27 10.39 9.48 8.56 /34 7.50 6.85 6.62 SCR0137-4148 1 01 37 23.5 −41 48 56 0.238 054.2 1 ... ... ... ... 16.91 14.55 12.24 15.33 13.99 12.30 /71 10.68 10.07 9.78 SCR0138-6029 1 01 38 01.1 −60 29 56 0.563 084.4 1 ... ... ... ... 17.46 15.17 12.44 16.61 15.07 13.16 1/ 11.19 10.66 10.29 GJ0065 2 01 39 01.5 −17 57 02 3.368 080.4 36 .37370 .00270 1 63 12.78J 10.42J 7.58J 12.06J 10.40J 8.35J /6 6.28J 5.69J 5.34J L294-078 1 01 39 11.5 −48 17 50 0.266 106.4 1 ... ... ... ... 15.17 13.11 11.10 ... ... ... ... 9.82 9.18 8.95 LP991-084 1 01 39 21.7 −39 36 09 0.283 146.1 1 ... ... ... ... 15.85 13.64 10.79 14.48 12.97 11.06 3/ 9.21 8.63 8.27 SCR0139-5927 1 01 39 39.8 −59 27 56 0.205 041.8 1 ... ... ... ... 12.81 10.81 9.50 ... ... ... ... 8.51 7.85 7.66 WT0050 1 01 46 29.4 −53 39 33 0.211 121.3 1 ... ... ... ... 15.53 13.31 10.90 14.18 12.81 11.08 2/ 9.46 8.85c 8.61 L870-044 1 01 46 36.8 −08 38 58 0.422 108.2 1 ... ... ... ... 13.87 11.68 10.25 12.99 11.82 10.30 /70 8.83 8.24 7.99 L294-092 1 01 47 42.6 −48 36 06 0.371 141.5 1 ... ... ... ... 13.83 11.53 9.61 12.42 11.23 9.72 3/ 8.25 7.69 7.45 L173-039 1 01 48 26.0 −56 58 42 0.272 092.5 1 ... ... ... ... 13.09 11.14 9.30 11.76 10.73 9.47 2/ 8.22 7.55c 7.32 L052-022 1 01 48 26.2 −70 58 29 0.445 077.9 1 ... ... ... ... 12.67 10.49 8.71 ... ... ... ... 8.81 8.25 7.97 SCR0149-8038 1 01 49 42.7 −80 38 28 0.611 085.5 1 ... ... ... ... 18.42 16.36 13.84 17.14 15.60 13.69 2/ 11.68 11.11 10.72 LP940-020 1 01 49 43.5 −33 19 20 0.439 079.5 1 ... ... ... ... 17.00 14.85 12.39 ... ... ... ... 10.92 10.32 10.01 LP940-021 1 01 50 13.3 −37 41 52 0.230 112.3 1 ... ... ... ... 15.80 13.49 11.41 14.47 13.23 11.64 /71 10.11 9.54 9.24 LHS1300 1 01 50 20.1 −49 36 40 0.564 096.9 1 ... ... ... ... 14.87 12.77 11.08 ... ... ... ... 9.84 9.26 8.99 LHS5043 1 01 50 53.3 −34 24 39 0.500 120.0 1 ... ... ... ... 15.05 12.93 11.31 ... ... ... ... 9.96 9.35 9.07 LHS1302 1 01 51 04.1 −06 07 05 0.609 118.6 1 .10078 .00189 1 25 15.22 12.76 10.25 14.49 13.00 11.17 /49 9.41 8.84 8.55 GJ0078 1 01 51 48.7 −10 48 13 0.793 134.0 63 .06159 .00280 2 63,64 12.57 10.51 9.33 11.80 10.81 9.59 /5 8.38 7.85 7.63 GJ0079 1 01 52 49.2 −22 26 06 0.845 090.0 28 .09077 .00115 2 63,64 10.03 7.70 6.34 8.88 7.98 7.08 /5 6.06 5.41 5.18 LHS5045 1 01 52 51.6 −48 05 41 0.565 247.5 1 ... ... ... ... 15.22 12.94 10.65 13.79 12.48 10.80 3/ 9.17 8.60c 8.24 LTT01010 1 01 53 11.4 −21 05 43 0.282 075.5 1 ... ... ... ... 12.15 10.03 8.68 11.42 10.42 9.26 /46 8.07 7.42c 7.14 L088-043 1 01 53 37.1 −66 53 34 0.417 065.0 1 ... ... ... ... 12.40 10.39 8.54 11.68 10.60 9.24 3/ 7.91 7.29 6.99 LHS1311 1 01 53 50.6 −10 32 14 0.691 114.8 1 ... ... ... ... 16.58 14.47 11.75 15.43 14.03 12.22 /69 10.45 9.93 9.65 LP768-670 1 01 54 08.0 −15 36 22 0.316 163.9 1 ... ... ... ... 15.23 12.82 10.68 14.42 13.13 11.44 /46 9.81 9.22 8.90 L223-077 1 01 55 13.2 −53 06 31 0.400 047.6 1 ... ... ... ... 16.65 14.61 12.23 ... ... ... ... 10.54 9.98 9.73 LHS1325 1 02 00 47.3 −10 21 21 0.488 226.7 1 ... ... ... ... 15.18 12.96 10.99 ... ... ... ... 9.89 9.35 9.09 LP709-018 1 02 01 43.9 −10 17 29 0.340 042.1 1 ... ... ... ... 15.61 13.37 11.42 ... ... ... ... 10.03 9.47 9.19 L655-017 1 02 03 20.8 −21 13 43 0.438 205.1 1 ... ... ... ... 11.28 9.34 7.38 11.21 10.18 8.90 /66 7.61 7.03 6.77 LHS1332 1 02 04 27.5 −01 52 57 0.812 223.2 1 ... ... ... ... 14.76 12.68 10.74 13.77 12.59 11.04 /69 9.59 9.09 8.80 GJ0084 2 02 05 04.9 −17 36 53 1.315 097.4 28 .10959 .00187 2 63,64 10.39J 8.35J 6.54J 10.19J 9.14J 7.84J /5 6.54J 5.90J 5.66J GJ0084.1 2(1) 02 05 23.7 −28 04 11 0.572 037.5 1 .04324 .00206 2 63,64 11.93 9.92 8.64 10.88 10.00 9.04 /5 7.99 7.35c 7.16 LHS1339 1 02 05 48.6 −30 10 36 0.500 282.1 1 .10781 .00292 1 64 13.34 11.02 9.42 12.18 11.07 9.69 3/ 8.37 7.87 7.56 GJ0085 1 02 07 23.3 −66 34 12 1.798 078.0 63 ... ... ... ... 12.18 9.79 8.45 11.49 10.49 9.31 3/ 8.13 7.61 7.36

– 37 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS1347 1 02 09 36.1 −14 21 33 0.610 127.7 1 .05089 .00247 2 63,64 12.38 9.36 8.42 11.81 10.75 9.46 /69 8.12 7.50 7.26 LP709-043 1 02 10 03.7 −08 53 00 0.390 241.2 1 ... ... ... ... 13.89 11.72 9.86 13.05 11.91 10.40 /44 8.95 8.34c 8.08 SCR0210-6622 1 02 10 45.1 −66 22 27 0.883 067.8 1 ... ... ... ... 16.86 14.60 12.15 15.94 14.56 12.77 1/ 10.97 10.43 10.09 LHS1351 1 02 11 18.0 −63 13 41 0.765 243.2 47 .07153 .00164 1 47 12.99 10.60 9.14 12.23 11.15 9.82 /47 8.54 7.98 7.73 LHS1354 2 02 12 29.2 −08 04 10 0.756 227.3 36 ... ... ... ... 12.70J 10.91J 9.84J 11.99J 11.06J 9.86J /69 8.65J 8.07J 7.83J LHS1356 1 02 12 58.8 −73 45 50 0.535 065.9 1 ... ... ... ... 13.84 11.68 10.09 ... ... ... ... 9.24 8.56 8.34 L296-105 1 02 13 53.0 −49 23 14 0.247 066.7 1 ... ... ... ... 14.34 12.07 10.34 ... ... ... ... 9.43 8.76 8.53 GJ0091 1 02 13 53.6 −32 02 29 0.911 122.5 1 .08004 .00168 2 63,64 10.96 9.10 7.30 10.31 9.32 8.15 /5 6.96 6.33 6.09 LHS1363 1 02 14 12.6 −03 57 44 0.504 105.0 1 ... ... ... ... 17.28 14.96 11.96 16.44 14.71 12.62 4/ 10.48 9.86 9.49 LP885-034 1 02 14 18.6 −30 33 47 0.269 067.0 1 ... ... ... ... 13.38 11.69 9.68 ... ... ... ... 8.82 8.24c 7.96 LHS1367 1 02 15 08.1 −30 40 01 0.854 116.9 1 ... ... ... ... 20.23 17.68 14.03 18.98 16.70 14.23 1/ 11.62 10.95 10.54 StKM1-249 1 02 15 20.0 −13 00 58 0.180 091.8 1 ... ... ... ... 12.48 10.44 9.23 ... ... ... ... 8.63 8.00 7.77 LHS1373 1 02 15 48.9 −12 40 27 0.558 067.1 1 ... ... ... ... 13.84 11.83 9.90 13.00 11.89 10.46 /69 9.05 8.47c 8.17 LP829-041 1 02 16 21.4 −22 00 49 0.260 334.8 1 ... ... ... ... 18.14 15.72 12.74 ... ... ... ... 11.31 10.76 10.40 SCR0216-5257 1 02 16 32.0 −52 57 47 0.193 234.3 1 ... ... ... ... 16.20 14.11 11.99 15.23 13.95 12.28 1/ 10.62 9.96 9.68 LHS1377 2(1) 02 16 41.2 −30 59 18 0.724 069.9 1 .06981 .00310 1 64 12.71 10.79 8.54 12.03 10.87 9.38 2/ 7.99 7.32 7.13 WT0084 1 02 17 28.5 −59 22 44 0.537 202.2 1 .07661 .00302 1 10 17.19 14.66 11.50 15.67 14.19 12.25 /10 10.44 9.87 9.54 GJ0093 1 02 17 34.2 −53 59 20 0.621 050.5 1 .04443 .00250 2 63,64 12.16 9.64 8.88 11.40 10.50 9.51 /5 8.47 7.83 7.65 L174-034 1 02 18 17.9 −55 07 33 0.484 069.0 1 ... ... ... ... 14.37 12.27 10.40 ... ... ... ... 9.48 8.91 8.64 GJ1046 2 02 19 10.1 −36 46 41 1.497 068.5 36 .07106 .00323 1 64 12.41J 10.11J 8.65J 11.56J 10.52J 9.19J 1/ 7.92J 7.32Jc 7.03J LP710-008 1 02 22 17.8 −13 11 06 0.254 087.4 1 ... ... ... ... 14.87 12.86 10.87 ... ... ... ... 9.83 9.23 8.96 LP941-057 1 02 22 18.3 −36 51 52 0.306 067.1 1 ... ... ... ... 17.45 15.20 12.57 ... ... ... ... 11.06 10.47 10.13 L440-002 1 02 22 25.6 −34 33 18 0.292 024.3 1 ... ... ... ... 12.11 9.73 8.68 ... ... ... ... 8.36 7.76 7.56 LP829-051 1 02 23 24.0 −23 18 25 0.349 217.4 1 ... ... ... ... 15.34 13.14 10.70 14.21 12.98 11.38 /44 9.86 9.31 9.01 L296-061 1 02 24 26.6 −47 10 24 0.247 000.4 1 ... ... ... ... 14.00 11.29 9.74 ... ... ... ... 8.96 8.37 8.18 LP885-059 1 02 26 32.8 −29 30 56 0.431 070.9 1 ... ... ... ... 12.50 10.89 9.16 ... ... ... ... 8.94 8.26 8.05 L513-008 1 02 27 30.4 −30 54 36 0.431 099.1 1 .04850 .00196 1 64 11.45 9.30 7.78 10.89 9.93 8.88 /34 7.76 7.11 6.93 LP941-090 1 02 28 07.7 −36 28 20 0.486 094.1 1 ... ... ... ... 14.88 12.77 10.56 ... ... ... ... 9.72 9.14 8.87 LHS1412 1 02 30 34.9 −15 43 25 0.532 099.0 1 ... ... ... ... 13.94 11.91 10.19 ... ... ... ... 9.28 8.65 8.42 LP650-158 1 02 31 33.3 −03 56 23 0.203 096.2 1 ... ... ... ... ... 10.51 9.30 12.43 11.43 10.25 /46 8.95 8.31c 8.08 L225-057 1 02 34 21.2 −53 05 37 0.425 141.4 1 ... ... ... ... 13.57 11.09 9.28 12.53 11.32 9.76 2/ 8.23 7.61 7.31 GJ0103 2 02 34 22.6 −43 47 47 0.300 157.7 1 .08618 .00078 2 63,64 9.59J 6.85J 6.92J 8.84J 7.96J 7.00J /5 5.80J 5.13J 4.89J APM0237-5928 1 02 36 32.5 −59 28 06 0.731 054.8 1 .10372 .00112 1 25 15.29 12.70 9.96 14.47 12.96 11.08 /25 9.28 8.70 8.34 L174-028 1 02 37 52.8 −58 45 11 0.216 022.0 1 .06662 .00337 1 64 12.92 11.03 8.73 12.44 11.27 9.78 1/ 8.36 7.79 7.51 LEHPM1-2662 1 02 38 49.1 −39 16 37 0.188 063.1 1 ... ... ... ... 16.47 14.21 11.89 ... ... ... ... 10.62 9.98 9.70 GJ1050 1 02 39 50.7 −34 07 58 1.737 162.5 29 .09374 .00444 1 29 12.59 10.38 8.57 11.76 10.68 9.35 3/29u 8.06 7.54 7.31 G075-035 1 02 41 15.1 −04 32 18 0.353 097.6 1 ... ... ... ... 14.50 12.23 10.02 13.79 12.48 10.77 2/ 9.20 8.58c 8.25 LHS1434 1 02 42 56.3 −38 56 12 0.597 102.0 1 ... ... ... ... 14.25 12.13 10.36 13.04 11.96 10.56 1/ 9.24 8.64 8.38 GJ1051 1 02 43 53.2 −08 49 46 0.973 140.3 1 .04029 .00390 2 63,64 11.94 10.25 8.49 11.91 10.95 9.83 /34 8.69 8.10 7.92 LP993-115 3(1) 02 45 14.3 −43 44 11 0.433 168.4 1 .08737a .00133 2 49,49 12.98 10.79 8.22 12.38 11.17 9.61 /49 8.06 7.53 7.20 LP711-005 1 02 45 18.5 −13 56 24 0.262 174.0 1 ... ... ... ... 14.16 12.04 10.01 ... ... ... ... 9.45 8.81 8.59 SCR0246-7024 1 02 46 02.3 −70 24 06 0.259 113.3 1 ... ... ... ... 15.71 13.33 10.71 14.86 13.44 11.61 /71 9.84 9.33 9.02 LHS0017 1 02 46 14.9 −04 59 21 2.524 138.1 36 .06030 .00820 1 63 17.23 15.04 12.10 16.36 14.75 12.76 1/ 10.97 10.50 10.15 LTT01349 1 02 46 42.9 −23 05 12 0.300 069.4 1 .04345 .00172 1 64 11.20 8.99 8.03 10.24 9.36 8.54 /34 7.56 6.93 6.74 LP771-021 1 02 48 41.0 −16 51 22 0.272 192.1 1 .06160 .00540 1 62 21.23 18.52 15.02 20.02 17.71 15.32 /16 12.55 11.87 11.42 GJ0114.1 1 02 50 09.8 −53 08 20 0.521 348.9 1 .07634 .00162 2 63,64 11.57 9.05 7.82 10.72 9.73 8.55 /5 7.35 6.75 6.50 LEHPM1-2816 1 02 50 23.0 −21 04 45 0.250 064.9 1 ... ... ... ... 13.79 11.78 9.96 ... ... ... ... 9.32 8.72 8.51 GJ0118 1 02 52 22.2 −63 40 48 1.149 058.0 63 .08579 .00197 2 63,64 12.17 9.80 8.23 11.38 10.32 8.99 /5 7.67 7.12 6.83 LEHPM1-2855 1 02 52 29.3 −24 17 19 0.190 078.1 1 ... ... ... ... 13.40 11.60 9.45 ... ... ... ... 9.05 8.37 8.17

– 38 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

L012-006 1 02 53 17.0 −80 31 20 0.396 073.0 1 ... ... ... ... 15.14 13.10 11.12 14.10 12.92 11.42 2/ 10.00 9.40 9.09 L127-058 1 02 53 46.9 −61 35 19 0.192 048.4 1 ... ... ... ... 13.16 11.03 9.48 ... ... ... ... 8.57 7.95 7.70 LP831-001 1 02 54 39.5 −22 15 59 0.410 101.9 1 ... ... ... ... 13.68 11.58 9.57 ... ... ... ... 8.98 8.44 8.17 LHS1471 1 02 55 14.5 −51 40 21 0.656 070.5 1 ... ... ... ... 15.35 13.25 11.13 ... ... ... ... 9.94 9.37 9.08 LHS1481 1 02 58 10.2 −12 53 06 0.618 016.0 1 ... ... ... ... 13.71 11.25 10.00 12.69 11.58 10.23 2/ 8.95 8.45 8.20 LTT01445 3 03 01 51.0 −16 35 31 0.503 238.3 1 .14381a .00249 3 25,25,6 11.03J 8.55J 6.82J 11.22 10.07 8.66 /25 7.11 6.56 6.29 LHS1490 1 03 02 06.4 −39 50 52 0.859 221.3 1 ... ... ... ... 17.18 14.49 11.93 15.87 14.35 12.44 3/ 10.71 10.18 9.89 G075-060 1 03 02 09.8 −00 44 43 0.448 100.5 1 ... ... ... ... 14.28 12.33 10.68 ... ... ... ... 9.53 8.94 8.71 APM0302-6952 1 03 02 30.8 −69 52 03 0.560 131.9 1 ... ... ... ... 15.09 13.02 10.97 ... ... ... ... 9.69 9.18 8.91 GJ0121.1 1 03 02 38.1 −18 09 59 0.446 068.9 1 .05183 .00387 2 63,64 12.30 10.70 8.46 11.80 10.76 9.46 /5 8.21 7.59 7.34 LEHPM1-3019 1 03 03 00.7 −55 24 53 0.237 045.9 1 ... ... ... ... 16.27 14.04 11.70 ... ... ... ... 10.45 9.93 9.60 LP711-044 2(1) 03 03 47.9 −12 51 19 0.246 118.2 1 ... ... ... ... 14.46 12.11 10.52 13.37 12.22 10.73 /67 9.28 8.66 8.37 LHS1491 1 03 04 04.5 −20 22 43 0.703 138.9 1 .06728 .00125 1 47 13.56 11.80 9.49 12.84 11.65 10.13 /47 8.63 8.02 7.75 LEHPM1-3070 1 03 06 11.6 −36 47 53 0.690 196.0 16 .07646 .00142 1 16 20.55 17.79 13.76 19.38 16.98 14.49 /16 11.69 11.07 10.63 GJ1054 3(2) 03 07 55.8 −28 13 11 0.342 249.8 1 .05550 .00250 1 18 10.11J 8.05J 6.82J 10.24J 9.35J 8.38J /68 7.24J 6.58J 6.37J LP994-114 1 03 09 22.2 −39 11 03 0.392 090.6 1 ... ... ... ... 13.56 11.96 9.99 ... ... ... ... 9.00 8.37 8.15 LP831-035 1 03 10 03.1 −23 41 31 0.197 143.8 1 ... ... ... ... 14.35 12.31 10.14 ... ... ... ... 9.41 8.78 8.57 LTT01505 1 03 11 36.7 −04 16 37 0.423 157.0 1 ... ... ... ... 13.75 11.76 9.72 13.38 12.21 10.71 /44 9.33 8.72 8.46 GJ0130 1 03 12 29.8 −38 05 20 1.460 060.1 1 .07960 .00970 1 63 ... 10.39 8.76 11.43 10.40 9.18 /5 8.03 7.42 7.19 LP831-045 1 03 14 18.2 −23 09 30 0.397 062.4 1 ... ... ... ... 13.29 11.09 9.37 12.58 11.42 9.93 3/ 8.49 7.88 7.63 StKM1-350 1 03 14 36.7 −09 40 03 0.273 230.2 1 ... ... ... ... 11.80 9.97 8.67 11.63 10.67 9.62 /66 8.53 7.91 7.68 LP831-068 1 03 16 47.8 −21 25 26 0.295 061.0 1 ... ... ... ... 11.55 9.90 7.97 11.04 10.01 8.79 2/ 7.61 6.95 6.69 LP994-091 1 03 17 03.0 −42 14 33 0.414 174.0 38 ... ... ... ... 14.62 12.63 10.46 ... ... ... ... 9.70 9.13 8.85 LP887-070 1 03 18 04.0 −30 24 12 0.342 208.3 1 .04349 .00255 1 64 11.69 9.68 7.87 11.00 10.05 9.05 /34 7.99 7.36 7.12 LP994-096 1 03 18 45.5 −40 51 34 0.338 030.0 1 ... ... ... ... 12.96 11.03 8.85 12.10 10.99 9.61 1/ 8.29 7.71 7.39 LTT01577 1 03 18 58.3 −36 23 35 0.198 229.9 1 .04959 .00315 1 64 12.12 9.66 8.20 11.88 10.82 9.51 /34 8.21 7.63c 7.40 LTT01578 1 03 19 29.2 −30 59 44 0.364 050.7 1 ... ... ... ... 15.00 12.80 10.30 14.00 12.78 11.18 /44 9.65 9.06 8.78 2MA0320-0446 1 03 20 28.4 −04 46 37 0.678 190.6 14 ... ... ... ... ... 19.84 16.56 21.18 18.85 16.37 4/ 13.26 12.54 12.13 L127-124 1 03 20 51.8 −63 51 53 0.309 174.9 1 ... ... ... ... 14.29 11.95 9.49 ... ... ... ... 9.13 8.54 8.20 DEN0320-5520 1 03 20 58.9 −55 20 16 0.398 048.4 1 ... ... ... ... 19.39 17.24 14.24 ... ... ... ... 12.07 11.45 11.08 LTT17505 1 03 21 46.9 −06 40 24 0.331 101.5 1 ... ... ... ... 12.54 10.39 8.92 11.32 10.29 9.07 2/ 7.86 7.28 6.98 LP832-007 1 03 23 06.7 −24 13 28 0.248 165.0 1 ... ... ... ... 15.00 12.91 10.83 ... ... ... ... 9.87 9.24 8.99 DEN0324-7727 1 03 24 26.9 −77 27 05 0.326 054.3 1 ... ... ... ... 19.88 17.56 14.39 ... ... ... ... 12.10 11.46 11.05 LTT01628 1 03 25 39.7 −42 59 12 0.355 113.4 1 .04292 .00211 1 64 11.96 9.85 8.61 11.25 10.33 9.35 /34 8.30 7.73 7.48 SCR0327-3634 1 03 27 46.8 −36 34 40 0.184 244.6 1 ... ... ... ... 13.40 11.29 9.27 12.69 11.61 10.24 2/ 8.92 8.26 8.04 L055-011 1 03 28 08.4 −70 01 41 0.313 019.3 1 ... ... ... ... 14.08 12.04 10.40 ... ... ... ... 9.41 8.81 8.59 GJ0143.1 1 03 29 19.8 −11 40 42 0.329 169.2 1 .04538 .00196 2 63,64 10.17 8.03 7.28 9.95 9.10 8.27 /5 7.30 6.65 6.45 LP888-018 1 03 31 30.3 −30 42 39 0.406 174.0 1 ... ... ... ... 19.91 17.26 13.55 18.81 16.55 14.10 2/ 11.36 10.70 10.26 GJ0145 1 03 32 55.8 −44 42 07 0.335 293.7 1 .09293 .00192 2 63,64 11.80 9.97 8.02 11.47 10.40 9.06 /5 7.74 7.21 6.91 LEHPM1-3396 1 03 34 12.2 −49 53 32 2.448 077.6 1 .12060 .00360 1 19 20.50 17.54 13.92 19.38 16.85 14.39 3/ 11.38 10.82 10.39 LHS0176 1 03 35 38.6 −08 29 23 1.550 101.9 30 .07777 .00130 1 30 17.04 14.66 11.60 15.92 14.30 12.31 /30 10.38 9.80 9.46 GJ1061 1 03 35 59.7 −44 30 45 0.802 114.4 1 .27201 .00130 2 25,26 13.51 11.20 8.37 13.09 11.45 9.47 6/25u 7.52 7.02 6.61 LHS1567 1 03 36 06.7 −40 59 54 0.547 206.2 1 ... ... ... ... 13.76 11.95 9.79 ... ... ... ... 9.29 8.64 8.39 LEHPM1-3427 1 03 36 47.6 −55 45 08 0.223 000.8 1 ... ... ... ... 15.17 13.05 10.79 ... ... ... ... 9.86 9.31 9.01 LHS1572 2 03 38 10.0 −68 56 46 0.555 029.6 1 ... ... ... ... 12.92J 10.62J 9.20J 11.95J 10.86J 9.52J 1/ 8.21J 7.60J 7.37J GJ1062 1 03 38 15.7 −11 29 14 3.033 152.1 36 .06240 .00330 1 63 13.92 11.55 9.84 13.01 11.98 10.81 /69 9.63 9.11 8.83 L228-092 1 03 38 55.9 −52 34 11 0.256 034.9 1 ... ... ... ... 15.67 13.18 10.90 ... ... ... ... 9.69 9.11 8.80 LP944-020 1 03 39 35.3 −35 25 44 0.411 047.8 1 .15847 .00100 2 16,62 20.24 17.02 13.29 18.70 16.39 14.01 /16 10.73 10.02 9.55 L128-007 1 03 40 08.9 −60 35 59 0.217 216.9 1 ... ... ... ... 13.35 11.10 9.67 ... ... ... ... 9.00 8.43 8.13

– 39 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

SCR0342-6407 1 03 42 57.4 −64 07 57 1.071 141.4 1 .04156 .00201 1 30 17.17 15.13 12.34 16.01 14.65 12.89 /30 11.32 10.89 10.58 LHS1582 2 03 43 22.1 −09 33 51 0.505 053.4 1 .04604 .00178 1 47 15.73J 13.37J 10.95J 14.69J 13.33J 11.60J /47 9.80J 9.18J 8.85J LP944-038 2 03 44 47.9 −38 20 13 0.420 064.7 1 ... ... ... ... 13.03J 10.78J 9.42J ... ... ... ... 8.59 8.02 7.79 LHS1590 1 03 46 45.4 −11 17 42 0.551 078.8 36 ... ... ... ... 13.25 10.91 9.44 12.70 11.64 10.31 /69 9.00 8.46 8.19 G080-021 1 03 47 23.4 −01 58 20 0.323 147.8 1 .06257 .00189 2 55,64 12.28 10.04 8.52 11.51 10.44 9.11 /44 7.80 7.17c 6.93 LEHPM1-3548 1 03 50 05.5 −39 22 32 0.244 041.6 1 ... ... ... ... 13.06 10.95 9.76 ... ... ... ... 8.94 8.31 8.05 GJ1065 1 03 50 44.3 −06 05 42 1.428 196.8 36 .10540 .00320 1 63 13.37 11.19 9.11 12.82 11.60 10.04 3/ 8.57 8.00c 7.75 LHS1604 1 03 51 00.0 −00 52 45 0.526 176.0 63 .06810 .00180 1 63 19.22 16.68 13.44 18.11 16.08 13.80 /16 11.30 10.61 10.23 LP833-014 2 03 52 23.1 −22 52 56 0.464 066.8 1 .04107 .00481 1 64 12.31J 10.24J 8.86J 11.46J 10.47J 9.31J /44 8.13J 7.53J 7.30J LEHPM1-3582 1 03 57 49.1 −37 54 04 0.218 106.5 1 ... ... ... ... 12.85 10.84 9.53 ... ... ... ... 8.53 7.89 7.66 LP833-023 1 04 00 28.6 −25 52 52 0.438 051.3 1 ... ... ... ... 14.32 12.30 10.27 ... ... ... ... 9.42 8.89 8.61 LHS1630 2 04 07 20.5 −24 29 14 0.704 161.1 1 .05618 .00106 1 47 13.22J 11.12J 9.22J 12.38J 11.22J 9.68J /47 8.24J 7.68J 7.44J LP889-037 1 04 08 55.6 −31 28 54 0.260 195.0 38 ... ... ... ... 15.47 13.29 10.87 14.56 13.21 11.48 2/ 9.78 9.16 8.82 GJ0163 1 04 09 15.7 −53 22 25 1.147 064.3 1 .06659 .00179 2 63,64 12.69 10.04 8.66 11.84 10.76 9.34 /5 7.95 7.43 7.14 GJ1068 1 04 10 28.1 −53 36 08 2.554 199.1 29 .14342 .00192 1 29 ... 12.11 9.81 13.60 12.18 10.42 3/29u 8.75 8.21 7.90 LP714-037 1 04 10 48.1 −12 51 43 0.426 203.0 37 ... ... ... ... 17.40 14.93 12.13 ... ... ... ... 11.01 10.37 9.92 LHS1641 1 04 12 43.1 −22 50 39 0.541 219.3 1 ... ... ... ... 14.44 12.47 10.57 ... ... ... ... 9.57 8.96 8.71 LHS1639 1 04 12 47.5 −53 52 04 0.810 041.9 1 ... ... ... ... 14.65 12.58 10.45 ... ... ... ... 9.51 8.92 8.68 G160-054 1 04 13 45.9 −05 09 05 0.247 119.4 1 ... ... ... ... 14.75 12.70 10.29 14.21 12.95 11.28 /45 9.72 9.11 8.82 GJ2033 2 04 16 41.7 −12 33 23 0.225 348.9 1 .04682 .00432 1 64 11.87J 9.80J 8.31J 10.91J 9.91J 8.76J /44 7.57J 6.98J 6.73J LEHPM1-3719 1 04 17 34.6 −48 34 39 0.658 028.0 1 ... ... ... ... 16.74 14.25 11.25 ... ... ... ... 10.28 9.71 9.34 LHS1654 1 04 18 04.7 −49 01 30 0.484 009.9 1 ... ... ... ... 13.81 11.68 9.70 ... ... ... ... 9.30 8.70 8.47 LP834-013 1 04 18 06.5 −24 06 24 0.389 194.1 1 ... ... ... ... 17.12 14.83 12.29 ... ... ... ... 10.92 10.34 10.02 LP834-015 1 04 18 40.1 −25 07 09 0.209 054.1 1 ... ... ... ... 16.32 13.99 11.70 ... ... ... ... 10.37 9.78 9.48 SCR0420-7005 1 04 20 12.6 −70 05 59 0.689 021.0 1 ... ... ... ... 18.18 15.68 12.58 17.09 15.35 13.25 /71 11.19 10.59 10.25 LHS1665 1 04 22 12.5 −57 26 01 0.534 207.1 1 ... ... ... ... 12.53 9.75 8.47 ... ... ... ... 8.08 7.50 7.21 LHS1668 1 04 24 56.2 −40 02 48 0.648 190.3 1 ... ... ... ... 15.03 12.62 10.38 14.10 12.77 11.07 /46 9.53 8.99 8.67 LHS0189 2 04 25 38.4 −06 52 37 1.204 145.7 11 .05424a .00303 2 11,11 14.55J 12.30J 10.81J 14.23J 13.17J 11.91J 2/ 11.14J 10.66Jc 10.31J LHS5094 1 04 26 32.6 −30 48 02 0.483 185.7 36 ... ... ... ... 15.06 12.99 10.53 14.17 12.73 10.99 2/ 9.30 8.72 8.41 LEHPM2-1698 1 04 27 05.8 −40 26 40 0.261 059.7 1 ... ... ... ... 15.65 13.45 11.21 ... ... ... ... 10.15 9.53 9.25 L178-101 1 04 27 36.2 −59 21 16 0.401 053.9 1 ... ... ... ... 14.21 12.09 10.31 ... ... ... ... 9.30 8.70 8.44 L130-037 1 04 28 05.7 −62 09 25 0.389 030.7 1 ... ... ... ... 14.15 12.06 9.96 13.06 11.88 10.36 2/ 8.94 8.34c 8.01 LP715-051 2 04 31 09.0 −13 30 53 0.254 219.5 1 .05233 .00356 1 64 12.53J 10.33J 8.85J 11.54J 10.49J 9.21J /34 7.96J 7.30J 7.05J SCR0433-0211 1 04 33 31.5 −02 11 01 0.354 137.7 1 ... ... ... ... 18.01 15.87 12.88 17.16 15.47 13.45 2/ 11.48 10.95 10.63 L231-032 1 04 33 39.7 −51 57 22 0.286 161.3 1 ... ... ... ... 13.46 11.35 9.76 ... ... ... ... 9.10 8.53c 8.25 LP775-031 1 04 35 16.1 −16 06 57 0.355 028.1 1 .09535 .00106 1 16 18.85 16.37 12.34 17.70 15.50 13.06 3/16u 10.41 9.78 9.35 LP834-032 1 04 35 36.2 −25 27 35 0.242 160.4 1 ... ... ... ... 13.21 10.98 8.83 12.44 11.26 9.73 2/ 8.24 7.65 7.41 L951-054 1 04 36 26.8 −03 43 56 0.464 195.2 36 ... ... ... ... 14.86 12.75 10.56 ... ... ... ... 9.69 9.07 8.81 L591-042 2(1) 04 36 40.9 −27 21 18 0.347 231.9 1 ... ... ... ... 12.95 10.94 9.19 12.25 11.20 9.88 2/ 8.61 7.98 7.73 GJ0173 1 04 37 41.9 −11 02 20 0.318 232.0 1 .09020 .00172 2 63,64 11.48 9.29 7.76 10.34 9.34 8.16 /5 6.94 6.33 6.09 LP655-043 1 04 38 02.5 −05 56 13 0.204 201.0 1 ... ... ... ... 15.54 13.42 10.80 14.44 13.14 11.41 /44 9.73 9.14 8.82 LP715-039 1 04 38 37.2 −11 30 15 0.371 227.4 1 ... ... ... ... 13.76 11.63 9.89 12.69 11.54 10.09 2/ 8.67 8.11 7.82 LP655-048 1 04 40 23.3 −05 30 08 0.359 069.2 49 .10261 .00071 1 49 18.85 16.49 13.17 17.79 15.72 13.36 /49 10.66 9.99 9.55 LP891-006 1 04 43 11.8 −32 26 42 0.205 107.7 1 ... ... ... ... 15.63 13.40 11.52 ... ... ... ... 10.25 9.58 9.33 UPM0444-3749 1 04 44 50.2 −37 49 41 0.236 100.4 1 ... ... ... ... 15.44 13.15 10.98 14.55 13.26 11.61 1/ 10.08 9.49 9.18 LP656-009 1 04 46 24.4 −02 49 08 0.194 216.7 1 ... ... ... ... 12.68 10.27 9.15 11.91 10.93 9.84 /44 8.68 8.09 7.86 LP835-018 1 04 48 01.0 −26 03 01 0.192 070.5 1 ... ... ... ... 16.93 14.71 12.10 ... ... ... ... 10.77 10.26 9.94 L736-001 1 04 49 32.8 −14 47 23 0.356 216.7 1 .04033 .00234 1 64 10.95 8.87 7.57 ... ... ... ... 8.05 7.41 7.20 APM0452-5819 1 04 51 37.3 −58 18 52 0.740 190.5 1 .05805 .00117 1 10 19.39 17.19 13.98 18.51 16.43 14.14 /10 11.69 11.09 10.71

– 40 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LP716-010 1 04 52 04.0 −10 58 22 0.423 241.0 1 ... ... ... ... 17.32 15.20 12.42 16.24 14.61 12.60 1/ 10.50 9.97 9.61 LP776-025 1 04 52 24.4 −16 49 22 0.243 150.7 28 ... ... ... ... ... 9.72 7.33 11.63 10.53 9.12 3/ 7.74 7.15 6.89 GJ0180 1 04 53 50.0 −17 46 24 0.767 148.1 28 .08260 .00232 2 63,64 12.22 9.80 8.41 10.91 9.89 8.69 /5 7.41 6.86 6.60 G084-025 1 04 57 58.6 −05 06 17 0.238 204.4 1 ... ... ... ... 15.84 13.50 11.04 ... ... ... ... 10.13 9.58 9.29 LP891-046 1 04 59 24.4 −30 55 58 0.385 084.3 1 ... ... ... ... 16.11 13.65 11.13 14.95 13.65 11.94 /45 10.23 9.63 9.35 L131-012 1 04 59 32.3 −61 53 04 0.200 275.9 1 ... ... ... ... 13.55 11.29 9.47 ... ... ... ... 8.70 8.09 7.81 LHS1723 1 05 01 57.4 −06 56 47 0.769 226.9 25 .18792 .00126 1 25 13.00 10.57 8.48 12.20 10.86 9.18 4/25u 7.62 7.07 6.74 GJ0185 2 05 02 28.4 −21 15 24 0.278 206.9 1 .12027 .00167 2 18,63 9.32J 6.82J 5.81J 8.28J 7.37J 6.47J 3/ 5.45J 4.85J 4.60J LHS1731 1 05 03 20.1 −17 22 25 0.519 205.4 1 .10866 .00167 2 29,64 12.70 9.61 7.42 11.74 10.60 9.17 3/29u 7.82 7.24 6.94 LP716-035 1 05 05 11.8 −12 00 29 0.260 234.7 1 ... ... ... ... 13.83 11.55 9.66 12.97 11.51 10.35 /46 9.10 8.50 8.25 L057-064 1 05 08 09.1 −73 26 50 0.290 299.4 1 ... ... ... ... 13.98 11.80 11.26 ... ... ... ... 9.44 8.83 8.58 GJ0190 2 05 08 35.1 −18 10 19 1.487 159.4 1 .10757 .00208 2 63,64 10.57J 8.52J 6.48J 10.31J 9.15J 7.64J 3/ 6.18J 5.59J 5.31J LP717-003 1 05 09 19.4 −13 48 41 0.286 095.2 1 ... ... ... ... 17.26 15.16 12.68 ... ... ... ... 10.93 10.35 10.03 SCR0509-4325 1 05 09 43.9 −43 25 17 0.225 324.9 1 ... ... ... ... 15.12 13.00 10.71 14.09 12.83 11.21 /71 9.61 9.00 8.74 GJ0191 1 05 11 40.6 −45 01 06 8.728 131.4 28 .25567 .00091 2 63,64 10.01 7.42 6.47 8.85 7.90 6.90 /5 5.82 5.32 5.05 WT2419 1 05 11 44.6 −36 12 31 0.181 182.7 1 ... ... ... ... 16.23 14.33 11.98 ... ... ... ... 10.52 9.97 9.68 L031-041 1 05 13 06.0 −76 53 22 0.274 301.2 1 ... ... ... ... 14.54 12.32 11.23 12.99 11.89 10.52 /71 9.24 8.63 8.36 LTT02208 1 05 13 47.3 −31 19 34 0.383 083.7 1 ... ... ... ... 15.74 13.52 11.34 14.45 13.26 11.69 /45 10.16 9.61 9.32 G084-040 1 05 13 50.8 −01 03 07 0.296 026.6 1 ... ... ... ... 13.44 11.16 9.01 ... ... ... ... 9.16 8.50 8.34 L521-011 1 05 14 53.6 −33 04 30 0.250 058.4 1 ... ... ... ... 16.23 14.03 11.83 14.97 13.63 11.87 1/ 10.09 9.44 9.17 LHS1747 1 05 15 08.1 −07 20 49 0.514 148.0 28 .04454 .00406 1 64 12.24 9.84 8.91 11.54 10.57 9.51 /34 8.36 7.82 7.52 LHS1748 1 05 15 46.7 −31 17 45 0.593 065.6 1 .04318 .00140 1 47 13.20 10.96 9.35 12.08 11.06 9.83 /47u 8.59 7.99 7.73 LHS1749 2 05 16 00.4 −72 14 13 0.814 356.4 47 .04608 .00140 2 11,47 13.64J 12.03J 10.41J 11.74J 10.70J 9.47J /47 8.21J 7.62J 7.36J GJ1077 1 05 16 59.7 −78 17 20 1.123 176.0 1 .06571 .00188 2 30,63 12.84 10.75 9.07 11.90 10.81 9.42 /30 8.07 7.44 7.20 SCR0517-4252 1 05 17 21.4 −42 52 47 0.186 012.8 1 ... ... ... ... 12.79 10.29 9.25 11.92 10.87 9.61 3/ 8.34 7.73c 7.45 L449-001 2 05 17 22.9 −35 21 55 0.269 230.6 1 .08438 .00135 1 49 13.02J 10.70J 8.65J 11.69J 10.48J 8.91J /49 7.40J 6.85J 6.56J 2MA0517-3349 1 05 17 37.7 −33 49 03 0.560 124.7 1 ... ... ... ... 20.89 18.36 15.10 19.75 17.38 14.96 3/ 12.00 11.32 10.83 LP892-032 1 05 18 36.6 −28 42 07 0.412 000.6 1 ... ... ... ... 17.22 14.92 12.25 ... ... ... ... 10.87 10.33 10.01 LP717-036 2 05 25 41.7 −09 09 13 0.208 164.2 1 ... ... ... ... 13.56J 11.43J 9.61J 12.59J 11.43J 9.92J 2/ 8.45J 7.88J 7.62J L233-036 1 05 25 48.6 −51 19 16 0.245 056.8 1 ... ... ... ... 14.63 12.64 10.75 ... ... ... ... 9.55 8.97 8.66 CD-42 01943 2 05 26 36.0 −42 20 18 0.183 259.1 1 ... ... ... ... 11.50J 9.32J 7.64J ... ... ... ... 7.77 7.19 6.94 L306-062 1 05 26 40.8 −48 51 47 0.279 158.7 1 ... ... ... ... 13.82 11.67 10.02 12.88 11.79 10.43 /71 9.10 8.46 8.24 LEHPM2-1009 1 05 27 30.6 −51 29 16 0.304 355.3 1 ... ... ... ... 16.97 14.79 11.95 ... ... ... ... 10.31 9.80 9.46 GJ0204.2 1 05 29 52.0 −03 26 30 0.540 211.2 1 .05680 .00650 1 63 12.71 10.53 9.23 12.03 10.94 9.60 /5 8.28 7.69 7.44 LTT02295 1 05 30 18.6 −53 58 48 0.443 026.8 1 ... ... ... ... 12.41 9.60 8.37 ... ... ... ... 7.91 7.28 7.01 L234-022 1 05 30 57.2 −53 30 52 0.249 181.7 1 ... ... ... ... 11.92 9.11 8.23 ... ... ... ... 7.93 7.31c 7.05 LHS1767 1 05 31 04.3 −30 11 45 0.615 140.9 1 .06526 .00151 1 47 14.15 11.86 9.99 13.11 11.93 10.45 /47 9.05 8.49c 8.19 GJ0205 1 05 31 27.4 −03 40 38 2.228 159.9 28 .17599 .00104 2 63,64 8.89 6.78 5.60 7.98 6.97 5.88 /5 5.00c 4.15c 4.04c LP718-005 1 05 35 21.3 −09 31 07 0.429 121.8 1 ... ... ... ... 19.64 17.27 13.79 ... ... ... ... 11.82 11.18 10.83 LHS5109 1 05 36 00.1 −07 38 59 0.472 003.7 1 ... ... ... ... 13.56 11.46 9.38 12.86 11.62 10.05 3/ 8.46 7.83 7.57 LP658-106 1 05 37 23.3 −08 16 06 0.408 174.7 1 ... ... ... ... 19.95 17.73 14.70 ... ... ... ... 12.30 11.70 11.35 WT0178 1 05 37 39.8 −61 54 44 0.506 011.7 1 .06202 .00089 1 47 15.60 13.61 11.09 14.81 13.47 11.77 /47 10.14 9.53 9.23 L378-006 1 05 40 02.6 −40 11 14 0.368 334.6 1 ... ... ... ... 13.54 11.41 9.52 ... ... ... ... 9.16 8.55 8.29 GJ2045 1 05 42 12.7 −05 27 56 0.980 351.4 1 .07958 .00115 4 10,19,29,63 16.58 15.16 11.55 15.34 13.84 11.93 2/29u 10.21 9.69 9.37 LP837-016 1 05 43 04.6 −26 35 40 0.205 020.8 1 ... ... ... ... 16.75 14.41 12.08 15.25 13.96 12.24 /45 10.57 9.96 9.72 APM0544-4108 1 05 43 46.6 −41 08 08 0.621 168.3 1 .04841 .00078 1 47 14.88 12.55 10.32 14.12 12.85 11.25 /47 9.74 9.16 8.87 2MA0544-2433 1 05 44 11.5 −24 33 03 0.700 165.0 1 ... ... ... ... 21.15 18.81 15.45 20.15 17.81 15.41 1/ 12.53 11.87 11.46 LP837-019 1 05 44 57.0 −21 36 56 0.352 345.0 1 ... ... ... ... 12.78 10.73 9.17 12.31 11.24 9.93 /44 8.65 8.06 7.82 LP837-020 1 05 44 57.9 −24 56 10 0.277 123.0 1 ... ... ... ... 17.01 14.81 12.41 ... ... ... ... 10.76 10.13 9.85

– 41 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS1785 1 05 47 09.1 −05 12 11 0.757 136.1 1 .05880 .00190 1 63 15.78 13.83 11.10 14.58 13.29 11.62 1/ 10.04 9.51 9.18 GJ0218 1 05 47 40.6 −36 19 43 0.781 099.1 28 .06704 .00142 2 63,64 11.33 9.06 7.84 10.74 9.77 8.62 /5 7.41 6.81 6.62 WT2440 1 05 47 50.2 −34 19 14 0.204 073.9 1 ... ... ... ... 12.53 10.34 8.87 ... ... ... ... 8.50 7.95c 7.71 L307-012 1 05 48 45.2 −45 55 42 0.258 330.4 1 ... ... ... ... 12.36 10.18 9.03 ... ... ... ... 8.68 8.03 7.85 LHS1793 1 05 52 29.2 −55 06 43 0.648 219.5 1 ... ... ... ... 14.03 11.81 10.22 ... ... ... ... 9.22 8.61 8.38 L379-017 1 05 53 40.1 −42 41 44 0.456 176.9 1 ... ... ... ... 14.29 12.00 10.07 ... ... ... ... 9.45 8.89 8.60 LP837-037 1 05 53 55.4 −22 46 58 0.270 147.0 1 ... ... ... ... 18.99 16.65 13.57 ... ... ... ... 11.62 11.05 10.70 LP837-053 1 05 55 43.2 −26 51 23 0.323 092.6 1 .06857 .00217 1 64 11.96 9.78 7.76 10.82 9.78 8.47 /34 7.18 6.48 6.29 LHS5112 2 05 56 56.2 −46 55 54 0.529 013.9 1 .04229 .00111 2 63,64 11.63J 9.56J 8.23J 10.58J 9.66J 8.72J /34 7.64J 7.00J 6.79J UPM0559-5225 1 05 59 33.2 −52 25 05 0.189 042.8 1 ... ... ... ... 14.67 12.54 10.57 13.66 12.49 11.00 1/ 9.63 8.95 8.70 LHS1807 1 06 02 22.6 −20 19 44 0.574 353.7 1 .07100 .00158 1 47 14.47 12.28 10.22 13.26 12.10 10.62 /47 9.22 8.67 8.37 LHS1810 1 06 02 54.2 −09 15 04 0.645 168.9 1 ... ... ... ... 17.86 15.75 12.59 ... ... ... ... 10.98 10.40 10.03 APCOL 1 06 04 52.2 −34 33 36 0.330 003.6 1 .11921 .00098 1 48 13.78 11.70 9.03 12.96 11.49 9.60 /49 7.74 7.18 6.87 LP838-016 1 06 07 43.7 −25 44 42 0.262 220.9 1 .08814 .00250 1 64 12.58 10.33 8.48 11.88 10.78 9.37 ... 8.02 7.50c 7.17 LEHPM2-3528 1 06 07 58.1 −61 15 11 0.217 008.5 1 ... ... ... ... 15.75 13.43 11.13 14.57 13.26 11.57 /71 9.98 9.38 9.10 LHS1823 1 06 08 16.4 −32 16 46 0.717 094.1 1 ... ... ... ... 14.26 12.06 10.12 ... ... ... ... 9.01 8.50 8.20 GJ0229 2 06 10 34.6 −21 51 53 0.717 191.2 28 .17377 .00097 2 63,64 8.94J 7.37J 4.72J 8.10J 7.15J 6.08J 1/ 5.10J 4.39Jc 4.17Jc GJ1088 1 06 10 52.9 −43 24 18 0.748 014.5 1 .08703 .00128 1 47 13.20 10.95 9.05 12.28 11.11 9.61 /47 8.17 7.58c 7.31 L308-038 1 06 12 36.7 −47 29 33 0.370 036.3 1 ... ... ... ... 13.34 11.05 9.47 ... ... ... ... 8.85 8.23 7.98 SCR0613-3437 2 06 13 57.3 −34 37 02 0.312 042.7 1 ... ... ... ... 16.06J 14.09J 11.46J 15.32J 13.87J 12.05J 1/ 10.61J 10.06Jc 9.53J GJ0231.3 1 06 19 20.8 −06 39 22 0.648 183.2 1 .06820 .00890 1 63 13.58 11.33 9.17 13.06 11.92 10.50 /5 9.12 8.54 8.24 L308-057 1 06 21 06.7 −49 05 38 0.254 356.0 1 ... ... ... ... 14.41 11.94 9.55 ... ... ... ... 9.16 8.63c 8.35 UPM0621-6111 1 06 21 45.7 −61 11 13 0.204 004.8 1 ... ... ... ... 16.11 14.26 12.03 14.95 13.68 12.06 1/ 10.43 9.79 9.53 SCR0622-4956 1 06 22 36.1 −49 56 29 0.184 003.0 1 ... ... ... ... 17.40 15.16 12.45 16.30 14.88 13.05 1/ 11.20 10.62 10.29 2MA0623-3435 1 06 23 08.8 −34 35 53 0.263 017.9 1 ... ... ... ... 13.66 11.72 9.89 ... ... ... ... 9.24 8.69 8.38 GJ0234 2 06 29 23.5 −02 48 51 0.930 131.7 28 .24444 .00092 3 22,58,63 11.46J 8.58J 7.19J 11.12J 9.78J 8.04J 4/ 6.38J 5.75J 5.49J SCR0630-7643 2 06 30 46.6 −76 43 09 0.491 355.8 1 .11416 .00185 1 25 15.78J 13.56J 10.74J 14.82J 13.08J 11.00J /71 8.89J 8.28J 7.92J SCR0631-8811 1 06 31 31.0 −88 11 37 0.484 354.8 1 ... ... ... ... 16.96 14.67 11.46 15.65 14.05 12.04 /71 10.04 9.46 9.07 GJ0237 2 06 31 51.1 −43 32 03 0.263 261.1 1 .04287 .00141 2 63,64 11.42J 9.19J 8.04J 10.58J 9.64J 8.65J /5 7.63 7.00 6.79 LHS1852 1 06 32 22.0 −69 57 44 0.679 022.8 1 ... ... ... ... 14.02 11.75 9.97 12.97 11.89 10.53 1/ 9.23 8.61 8.38 L032-009 2(1) 06 33 43.3 −75 37 48 0.420 324.3 1 .11107a .00220 2 64,64 11.30 8.81 8.14 10.44 9.37 8.04 3/ 6.73 6.15 5.86 GJ0238 1 06 33 50.0 −58 31 43 0.903 332.2 1 .06094 .00192 2 63,64 12.54 10.10 8.84 11.66 10.61 9.27 /5 7.90 7.31 7.03 LTT02591 1 06 34 18.6 −31 52 23 0.388 199.2 1 ... ... ... ... 14.02 11.76 9.98 ... ... ... ... 9.20 8.58 8.29 SCR0634-5403 1 06 34 36.9 −54 03 13 0.528 176.4 1 ... ... ... ... 17.18 14.89 12.29 15.98 14.56 12.79 1/ 11.07 10.45 10.13 LP381-004 1 06 36 18.3 −40 00 24 0.247 285.9 1 .05115 .00168 1 64 11.52 9.50 8.91 10.59 9.66 8.72 /34 7.62 7.08 6.79 LP720-031 1 06 38 35.3 −14 04 58 0.280 247.2 1 ... ... ... ... 15.43 13.13 11.52 ... ... ... ... 10.02 9.43 9.14 LP780-032 1 06 39 37.4 −21 01 33 0.208 301.8 1 ... ... ... ... 13.26 11.04 9.02 12.77 11.55 9.99 3/ 8.51 7.91 7.65 L182-007 1 06 39 37.6 −55 36 35 0.381 274.6 1 .07519 .00110 1 64 10.48 8.30 7.18 9.81 8.88 7.93 /34 6.86 6.28 6.03 LP453-031 1 06 39 41.1 −36 59 03 0.276 165.8 1 ... ... ... ... 12.53 10.29 9.20 11.90 10.86 9.58 /46 8.30 7.63 7.42 LP780-023 1 06 40 08.6 −16 27 26 0.318 018.4 1 ... ... ... ... 13.95 11.69 9.68 12.94 11.83 10.43 /46 9.12 8.51 8.22 SCR0640-0552 1 06 40 14.0 −05 52 23 0.620 172.1 1 ... ... ... ... 11.23 8.79 7.59 10.22 9.22 8.03 /71 6.84 6.21 5.96 LP780-026 1 06 42 10.8 −15 43 15 0.322 216.8 1 ... ... ... ... 13.90 11.76 10.13 ... ... ... ... 9.38 8.72 8.51 SCR0642-6707 1 06 42 27.2 −67 07 20 0.804 120.2 1 ... ... ... ... 17.00 14.69 11.61 16.01 14.43 12.42 /71 10.62 10.15 9.81 L059-002 1 06 43 29.8 −70 03 21 0.193 005.2 1 ... ... ... ... 13.95 11.51 9.75 12.92 11.76 10.29 /71 8.85 8.28 7.97 L597-018 1 06 43 40.7 −26 24 41 0.464 225.1 1 ... ... ... ... 13.84 11.45 9.77 12.92 11.76 10.31 2/ 8.91 8.43c 8.13 SCR0644-4223 2 06 44 32.1 −42 23 45 0.197 163.8 1 ... ... ... ... 15.59J 13.35J 11.18J 14.44J 13.19J 11.55J /71 9.93J 9.27J 8.98J SCR0650-2135 1 06 50 26.6 −21 35 58 0.271 088.8 1 ... ... ... ... 18.18 16.10 13.06 17.18 15.49 13.49 2/ 11.51 10.89 10.55 LHS1873 1 06 50 59.5 −09 10 50 0.570 189.1 1 ... ... ... ... 13.73 11.51 9.19 13.31 12.20 10.76 /46 9.40 8.83c 8.56 DEN0652-2534 1 06 52 19.8 −25 34 50 0.294 300.8 1 .06376 .00094 1 16 ... 19.14 15.96 20.58 18.32 15.97 1/ 12.76 12.02 11.52

– 42 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

L059-054 1 06 52 37.8 −73 58 16 0.424 007.7 1 ... ... ... ... 13.79 11.75 10.08 ... ... ... ... 9.14 8.56c 8.29 LP721-012 1 06 56 00.9 −38 24 17 0.252 342.2 1 ... ... ... ... 13.28 11.00 9.36 ... ... ... ... 9.06 8.42 8.17 LP661-013 1 06 56 19.0 −08 35 46 0.248 164.0 37 ... ... ... ... 14.98 12.74 10.26 13.97 12.76 11.17 /46 9.63 9.07 8.76 LP382-056 2 06 57 11.7 −43 24 51 0.232 161.3 1 ... ... ... ... 11.58J 9.41J 8.01J 11.17J 10.12J 8.87J 2/ 7.59J 6.98J 6.76J GJ0257 2 06 57 46.6 −44 17 28 1.107 263.8 1 .12457 .00208 2 63,64 11.27J 9.12J 7.22J 10.85J 9.72J 8.32J /33 6.88J 6.37J 6.06J WT0204 1 06 58 18.9 −39 32 16 0.213 341.9 1 ... ... ... ... 13.78 11.42 9.44 13.18 12.02 10.60 3/ 9.23 8.64c 8.35 SCR0659-5622 1 06 59 40.8 −56 22 47 0.238 187.6 1 ... ... ... ... 15.80 13.48 11.19 14.81 13.50 11.85 1/ 10.35 9.77 9.49 WT1539 1 07 00 09.5 −28 47 02 0.222 246.7 1 ... ... ... ... 11.83 9.46 9.07 ... ... ... ... 7.94 7.33c 7.12 SCR0701-1437 1 07 01 36.6 −14 37 18 0.301 313.8 1 ... ... ... ... 17.71 15.57 12.68 16.36 14.90 13.05 1/ 11.25 10.67 10.32 WT0207 1 07 02 36.6 −40 06 28 0.632 103.2 11 .04044 .00133 1 11 16.07 13.88 11.38 15.13 13.90 12.26 1/ 10.74 10.26 9.96 SCR0702-6102 1 07 02 50.4 −61 02 48 0.812 051.5 1 ... ... ... ... 17.50 15.11 11.73 16.62 14.75 12.49 /71 10.36 9.85 9.52 GJ0263 2 07 04 17.7 −10 30 32 0.821 189.7 28 .06205 .00292 2 63,64 ... ... 7.83J 11.30J 10.18J 8.74J /5 7.31J 6.69J 6.43J LHS0225 2 07 04 45.8 −38 36 08 1.228 099.3 1 .05598a .00219 2 29,29 12.59J 10.47J 8.66J 12.87 11.85 10.51 /29 8.61 8.07 7.87 LEHPM2-0449 1 07 05 09.3 −80 29 50 0.385 353.1 1 ... ... ... ... 15.07 13.41 11.21 ... ... ... ... 9.95 9.32 9.06 GJ2055 1 07 07 22.9 −21 27 27 0.288 137.7 28 .05781 .00236 1 64 11.80 9.26 8.73 11.08 10.09 8.87 /34 7.63 7.03 6.80 ESO207-061 1 07 07 53.3 −49 00 50 0.404 355.3 1 .06093 .00302 2 62,63 ... 19.55 16.15 21.20 18.70 16.24 1/ 13.23 12.54 12.11 LP840-016 1 07 08 07.0 −22 48 47 0.502 239.9 1 ... ... ... ... 12.36 10.03 8.37 11.42 10.42 9.27 /46 8.09 7.51 7.27 APM0710-5704 1 07 09 37.7 −57 03 42 0.456 046.3 1 ... ... ... ... 14.49 12.17 9.88 13.64 12.36 10.73 2/ 9.25 8.63c 8.30 LHS1906 1 07 12 54.1 −52 20 06 0.938 344.0 63 ... ... ... ... 13.48 11.22 9.65 ... ... ... ... 8.88 8.32 8.06 SCR0713-0511 1 07 13 11.2 −05 11 49 0.319 187.2 1 ... ... ... ... 11.76 9.31 8.84 11.13 10.08 8.86 /71 7.65 7.08 6.82 LHS1909 1 07 15 49.0 −83 00 19 0.821 351.8 1 ... ... ... ... 12.12 10.51 8.92 ... ... ... ... 8.42 7.77 7.55 SCR0717-0501 1 07 17 17.1 −05 01 04 0.602 136.3 1 ... ... ... ... 13.86 11.34 8.83 13.29 12.02 10.39 /71 8.87 8.35c 8.05 LEHPM2-4145 1 07 18 14.0 −52 29 30 0.194 191.8 1 ... ... ... ... 12.35 9.93 9.27 ... ... ... ... 8.66 8.04c 7.80 L383-019 1 07 20 30.2 −40 55 33 0.447 119.9 1 ... ... ... ... 12.41 10.12 8.89 ... ... ... ... 8.46 7.86 7.61 L136-037 1 07 20 52.0 −62 10 12 0.344 303.1 1 ... ... ... ... 13.15 11.03 8.98 12.33 11.18 9.74 2/ 8.38 7.84c 7.52 LP527-012 1 07 21 54.4 −31 04 37 0.252 166.2 1 ... ... ... ... 14.15 11.62 9.61 ... ... ... ... 9.37 8.76c 8.54 L136-001 1 07 23 20.8 −60 06 13 0.462 010.5 1 ... ... ... ... 12.96 10.81 9.11 ... ... ... ... 8.59 8.03 7.76 SCR0723-8015 1 07 23 59.7 −80 15 18 0.817 329.3 1 ... ... ... ... 18.68 16.44 13.27 17.45 15.61 13.41 3/71u 11.30 10.82 10.44 SCR0724-3125 1 07 24 21.2 −31 25 58 0.209 282.6 1 ... ... ... ... 15.25 12.35 10.25 14.41 13.08 11.38 2/ 9.79 9.22 8.89 L383-082 1 07 25 35.6 −42 38 57 0.239 295.2 1 ... ... ... ... 14.69 12.39 10.53 ... ... ... ... 9.54 9.00 8.68 GJ1097 1 07 28 45.5 −03 17 53 0.931 150.5 1 .08608 .00183 2 63,64 12.06 9.67 8.84 11.43 10.33 8.93 /69 7.54 6.98 6.70 GJ2060 3(2) 07 28 51.4 −30 14 49 0.212 207.9 1 .06453 .00152 2 55,64 10.55J 8.14J 7.43J 9.92J 8.95J 7.83J /34 6.62J 5.97J 5.72J LHS1922 1 07 30 39.3 −44 24 01 0.487 341.1 1 ... ... ... ... 11.16 9.20 7.75 ... ... ... ... 7.52 6.87 6.68 SCR0731-4807 1 07 31 08.1 −48 07 33 0.235 317.7 1 ... ... ... ... 17.72 15.59 13.00 16.74 15.19 13.29 1/ 11.32 10.77 10.41 SCR0733-2749 1 07 33 26.8 −27 49 04 0.187 236.3 1 ... ... ... ... 17.37 14.96 12.05 16.03 14.56 12.73 1/ 11.01 10.43 10.08 SCR0733-4406 1 07 33 42.7 −44 06 13 0.298 161.6 1 ... ... ... ... 16.19 13.89 11.53 15.13 13.79 12.05 2/ 10.32 9.73 9.44 LHS1932 1 07 36 12.0 −51 55 21 0.586 044.3 1 .06192 .00098 1 47 13.25 11.05 9.27 12.48 11.36 9.92 /47 8.55 8.04 7.76 SCR0736-3024 1 07 36 56.7 −30 24 16 0.424 145.7 60 ... ... ... ... 14.76 12.06 9.46 13.64 12.41 10.83 /71 9.36 8.79 8.50 L528-016 1 07 38 09.7 −31 12 19 0.251 318.7 1 ... ... ... ... 12.84 10.22 8.73 11.89 10.80 9.48 2/ 8.18 7.56 7.30 LHS1935 1 07 38 41.0 −21 13 28 0.657 136.3 28 .09431 .00331 1 64 12.08 9.85 8.26 11.72 10.62 9.23 /69 7.85 7.33 7.06 SCR0740-4257 1 07 40 11.8 −42 57 40 0.713 318.2 1 ... ... ... ... 14.52 12.37 9.99 13.81 12.36 10.50 /71 8.68 8.09 7.77 L034-026 1 07 49 12.7 −76 42 07 0.212 205.6 1 .09436 .00211 1 49 11.38 9.33 7.50 11.31 10.19 8.79 /49 7.41 6.86 6.58 GJ1103 1 07 51 54.7 −00 00 13 0.793 161.9 1 .11400 .00330 1 63 14.16 11.79 9.44 13.26 11.89 10.19 3/ 8.50 7.94c 7.66 SCR0754-3809 1 07 54 54.8 −38 09 38 0.400 351.4 1 ... ... ... ... 16.90 14.68 11.75 15.46 13.91 11.98 /71 10.01 9.42 9.08 LHS1955 2 07 54 54.8 −29 20 56 0.629 146.8 1 .07436 .00113 1 47 13.19J 10.75J 8.72J 12.79J 11.52J 9.89J /47 8.31J 7.69J 7.35J LHS1957 1 07 56 53.9 −45 38 14 0.650 342.7 1 ... ... ... ... 13.08 10.86 8.87 12.28 11.27 10.02 2/ 8.76 8.23 8.00 LHS5132 1 08 00 51.3 −57 30 34 0.492 138.3 1 ... ... ... ... 15.13 12.95 11.06 ... ... ... ... 9.91 9.35 9.05 SCR0803-1939 2 08 03 26.9 −19 39 28 0.292 149.5 1 ... ... ... ... 15.19J 12.66J 10.02J 14.26J 13.04J 11.48J 2/ 10.02J 9.45J 9.16J LHS1978 1 08 04 25.8 −83 13 59 0.606 309.7 1 ... ... ... ... 13.33 11.28 9.69 ... ... ... ... 8.97 8.35c 8.11

– 43 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

SCR0805-5912 1 08 05 46.2 −59 12 50 0.640 154.4 1 ... ... ... ... 15.76 13.76 11.33 14.69 13.38 11.68 /71 10.07 9.52 9.22 GJ0298 1 08 09 58.1 −52 58 05 0.832 322.6 1 .06001 .00243 2 63,64 12.89 10.61 8.87 11.81 10.73 9.34 /5 7.99 7.44 7.14 GJ0300 1 08 12 40.9 −21 33 07 0.699 178.7 25 .12578 .00097 2 25,63 12.79 9.57 8.07 12.15 10.85 9.22 /25 7.60 6.96 6.71 SCR0812-4504 1 08 12 44.3 −45 04 34 0.441 218.1 1 ... ... ... ... 18.70 16.66 13.29 17.54 15.87 13.82 1/ 11.73 11.23 10.91 GJ0301 2 08 13 08.5 −13 55 01 0.536 198.7 1 .05211 .00198 2 58,63 10.31J 8.29J 7.10J 9.37J 8.50J 7.66J /34 6.64J 6.04J 5.82J L242-075 1 08 13 26.1 −53 17 38 0.298 100.8 1 ... ... ... ... 12.99 10.82 9.73 ... ... ... ... 8.54 7.99 7.73 LHS1992 1 08 13 42.6 −76 07 49 0.685 337.4 1 ... ... ... ... 12.00 9.92 8.35 11.86 10.79 9.46 1/ 8.16 7.60c 7.30 LP843-016 1 08 14 22.6 −25 42 19 0.239 198.9 1 ... ... ... ... 11.87 9.71 8.35 11.55 10.55 9.34 /46 8.11 7.47 7.20 LP386-035 1 08 16 37.5 −42 12 26 0.245 301.3 1 ... ... ... ... 12.43 10.15 9.07 ... ... ... ... 8.76 8.08 7.88 L098-059 1 08 18 07.6 −68 18 47 0.391 162.6 1 ... ... ... ... 12.71 10.44 8.97 11.71 10.61 9.25 3/ 7.93 7.36 7.10 SCR0827-2526 1 08 27 07.0 −25 26 54 0.216 167.9 1 ... ... ... ... 14.91 12.29 10.12 13.90 12.66 11.10 2/ 9.65 9.09 8.78 LHS2010 1 08 27 11.8 −44 59 21 0.537 343.1 47 .07280 .00130 1 47 12.47 9.89 7.62 11.86 10.70 9.19 /47 7.75 7.15 6.87 SCR0829-3709 1 08 29 41.3 −37 09 35 0.327 300.8 1 ... ... ... ... 15.14 12.69 10.28 14.27 13.02 11.41 1/ 9.83 9.26 9.00 LHS2024 1 08 31 23.5 −10 29 54 0.668 241.7 1 ... ... ... ... 15.71 13.08 10.32 15.06 13.62 11.84 1/ 10.07 9.49 9.14 LHS2026 1 08 32 30.5 −01 34 39 0.540 151.9 1 .05080 .00050 1 63 19.83 17.07 13.68 18.94 16.69 14.32 /6 12.04 11.48 11.14 GJ2070 1 08 34 25.9 −01 08 40 0.455 152.0 63 .07340 .00960 1 63 13.74 11.70 9.83 ... ... ... ... 8.81 8.32 8.03 SCR0835-3400 1 08 35 31.7 −34 00 37 0.447 190.1 1 ... ... ... ... 15.31 12.76 10.25 14.26 12.99 11.39 1/ 9.90 9.37 9.08 SCR0837-2819 1 08 37 20.4 −28 19 58 0.256 140.7 1 ... ... ... ... 17.05 14.60 11.95 15.59 14.18 12.43 1/ 10.73 10.19 9.89 LP844-004 1 08 37 33.9 −22 32 32 0.185 261.8 1 ... ... ... ... 16.34 14.09 12.01 15.15 13.82 12.14 1/ 10.50 9.94 9.64 SCR0838-5855 1 08 38 02.2 −58 55 59 0.320 189.0 1 ... ... ... ... 18.44 16.11 12.44 17.19 15.08 12.78 3/71u 10.31 9.71 9.27 SCR0838-5302 1 08 38 13.2 −53 02 12 0.487 278.6 1 ... ... ... ... 21.75 17.81 15.23 18.89 17.01 14.81 1/ 12.50 11.85 11.45 LTT03201 1 08 38 54.5 −09 33 59 0.240 205.5 1 ... ... ... ... 12.33 10.02 8.59 11.80 10.80 9.59 /44 8.36 7.68 7.44 SCR0840-4044 1 08 40 01.7 −40 44 31 0.289 307.2 1 ... ... ... ... 17.19 15.24 12.50 16.29 14.81 12.97 1/ 11.19 10.64 10.25 GJ0317 1 08 40 59.2 −23 27 23 0.912 329.0 1 .06533 .00040 2 3,63 12.74 10.27 8.44 12.01 10.84 9.37 3/ 7.93 7.32c 7.03 G114-014 1 08 42 23.2 −04 53 55 0.318 190.2 1 ... ... ... ... 13.91 11.65 10.30 12.86 11.76 10.37 /44 9.05 8.54c 8.19 LP786-005 1 08 47 17.6 −20 58 20 0.299 322.4 1 ... ... ... ... 13.84 11.91 10.52 ... ... ... ... 9.44 8.75 8.56 L388-106 2(1) 08 48 23.2 −44 12 26 0.208 165.0 1 ... ... ... ... 14.60 12.33 10.36 ... ... ... ... 9.69 9.05 8.79 LEHPM2-0870 1 08 48 59.1 −80 35 02 0.317 205.8 1 ... ... ... ... 16.30 14.23 11.86 ... ... ... ... 10.42 9.79 9.50 SCR0852-6608 1 08 52 50.0 −66 08 47 0.519 334.2 1 ... ... ... ... 17.81 15.50 12.88 16.41 14.93 13.11 1/ 11.34 10.73 10.39 SCR0853-3924 1 08 53 28.7 −39 24 41 0.355 262.3 1 ... ... ... ... 13.21 10.86 8.34 12.32 11.22 9.87 2/ 8.51 7.94 7.72 LHS2065 1 08 53 36.2 −03 29 32 0.550 249.4 16 .11725 .00064 4 10,16,57,63 20.08 17.27 13.92 18.94 16.74 14.46 /16 11.21 10.47 9.94 L532-012 1 08 54 02.4 −30 51 37 0.274 266.3 1 ... ... ... ... 14.36 12.16 9.91 13.44 12.16 10.55 2/ 9.01 8.39 8.09 GJ0326 2 08 54 05.3 −13 07 31 0.622 148.0 63 .06180 .00670 1 63 12.75J 10.40J 8.77J 11.93J 10.81J 9.42J /69 8.05J 7.53J 7.26J LHS2071 2 08 55 20.3 −23 52 15 0.578 267.6 1 .06284 .00143 1 47 14.92J 12.56J 10.35J 13.88J 12.55J 10.82J /47 9.11J 8.54J 8.20J L139-024 1 08 56 06.6 −61 57 44 0.267 250.5 1 ... ... ... ... 14.27 12.33 10.94 ... ... ... ... 9.48 8.95c 8.67 LP844-033 1 08 56 17.6 −23 26 57 0.401 277.5 1 .04242 .00294 1 11 17.17 14.75 11.93 15.98 14.43 12.55 /11 10.70 10.13 9.82 LP606-030 1 08 58 43.3 −00 41 47 0.286 258.1 1 ... ... ... ... 18.64 16.32 15.20 17.40 15.77 13.75 1/ 11.72 11.15 10.76 GJ1118 1 08 59 05.3 −31 13 27 1.094 139.9 29 .05619 .00176 1 29 14.78 12.46 10.41 13.79 12.56 10.95 /29 9.41 8.86 8.59 2MA0901-6526 1 09 01 31.7 −65 26 40 0.245 338.0 1 ... ... ... ... 16.27 14.22 11.47 15.04 13.63 11.85 1/ 10.14 9.59 9.28 L063-046 1 09 01 39.0 −72 40 17 0.315 311.8 1 ... ... ... ... 13.61 11.53 9.50 12.41 11.37 10.09 1/ 8.82 8.24 7.99 LTT03347 1 09 04 02.3 −25 04 10 0.251 291.1 1 ... ... ... ... 13.38 11.31 9.84 ... ... ... ... 9.15 8.56 8.31 L244-024 1 09 05 17.9 −51 02 36 0.305 338.6 1 ... ... ... ... 14.67 12.57 10.55 ... ... ... ... 9.50 8.88c 8.64 SCR0905-0841 1 09 05 43.3 −08 41 58 0.368 120.9 1 ... ... ... ... 16.90 14.64 12.30 15.88 14.45 12.65 1/ 10.83 10.24 9.96 GJ0334 1 09 06 45.4 −08 48 25 0.366 304.6 28 .06912 .00124 2 63,64 10.24 8.13 7.05 9.50 8.59 7.68 /5 6.64 5.98 5.76 LHS2106 1 09 07 02.8 −22 08 50 0.499 211.7 1 .06623 .00116 1 47 15.11 12.72 10.18 14.21 12.87 11.13 /47 9.53 9.00 8.65 SCR0907-3533 1 09 07 17.1 −35 33 03 0.219 305.0 1 ... ... ... ... 14.39 12.85 10.60 13.89 12.73 11.28 1/ 9.85 9.28 8.96 L460-139 1 09 09 14.9 −39 59 32 0.237 209.0 1 ... ... ... ... 13.51 11.30 9.50 ... ... ... ... 9.15 8.54 8.32 SCR0914-4134 1 09 14 17.4 −41 34 38 0.749 312.5 60 ... ... ... ... 16.33 13.69 10.98 15.01 13.57 11.72 /71 9.98 9.42 9.12 LHS6167 2 09 15 36.4 −10 35 47 0.440 242.0 1 ... ... ... ... 14.86J 12.40J 9.79J 13.82J 12.32J 10.42J 3/ 8.61J 8.07J 7.73J

– 44 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

L749-034 1 09 16 20.7 −18 37 33 0.348 295.2 28 ... ... ... ... 11.06 8.89 7.56 10.73 9.72 8.54 3/ 7.35 6.76 6.49 LHS2122 1 09 16 26.0 −62 04 16 0.934 313.3 47 .05859 .00257 1 47 13.36 10.83 9.09 12.57 11.43 9.94 /47 8.47 7.83 7.55 LTT03416 1 09 16 44.0 −24 47 43 0.195 285.2 1 ... ... ... ... 12.55 10.31 9.04 ... ... ... ... 8.70 8.05 7.83 GJ1123 1 09 17 05.3 −77 49 23 1.052 141.6 29 .11092 .00202 1 29 14.17 12.15 9.88 13.16 11.86 10.16 /29 8.33 7.77 7.45 G161-013 1 09 20 11.1 −01 10 17 0.223 293.2 1 ... ... ... ... 14.88 12.74 11.00 ... ... ... ... 9.88 9.13 8.89 LEP0920-4922 1 09 20 26.0 −49 22 35 0.534 313.9 1 ... ... ... ... 17.88 16.67 13.68 ... ... ... ... 11.33 10.82 10.53 SIP0921-2104 1 09 21 14.1 −21 04 44 0.904 173.6 1 ... ... ... ... 22.26 19.07 16.03 20.85 18.50 16.17 2/ 12.78 12.15 11.69 GJ0341 1 09 21 37.6 −60 16 55 0.859 253.1 1 .09568 .00091 2 63,64 10.22 6.98 8.29 9.49 8.55 7.54 /5 6.44 5.79 5.59 LP902-060 1 09 23 32.4 −33 32 56 0.304 156.7 1 ... ... ... ... 12.83 10.46 9.77 ... ... ... ... 8.89 8.17 8.02 LP389-001 2(1) 09 24 17.3 −40 05 45 0.257 153.2 1 ... ... ... ... 11.35 9.45 8.15 ... ... ... ... 7.85 7.16 6.99 L822-019 1 09 28 41.6 −12 09 56 0.414 174.1 1 ... ... ... ... 13.06 10.75 9.48 12.23 11.23 9.05 /44 8.84 8.20c 7.95 GJ0347 2(1) 09 28 53.3 −07 22 16 0.773 195.1 1 .06106 .00286 2 63,64 12.40 10.27 9.03 12.10 11.05 9.72 /5 8.45 7.89 7.63 WT1637 1 09 29 03.8 −24 29 04 0.258 236.9 1 ... ... ... ... 18.28 15.94 12.73 ... ... ... ... 10.84 10.29 9.91 GJ0352 2 09 31 19.4 −13 29 19 0.733 087.9 1 .09848 .00310 2 58,63 9.76J 7.46J 5.74J 10.08J 9.03J 7.69J /5 6.36J 5.76J 5.51J LP788-001 1 09 31 22.3 −17 17 43 0.359 246.7 1 ... ... ... ... 18.99 16.74 13.14 17.55 15.63 13.38 2/ 11.07 10.47 10.07 LP846-015 1 09 34 27.9 −26 43 27 0.292 093.9 1 ... ... ... ... 15.36 12.94 10.71 ... ... ... ... 9.47 8.94 8.62 LTT03532 1 09 35 54.4 −33 43 51 0.261 130.5 1 ... ... ... ... 14.14 11.94 10.16 ... ... ... ... 9.39 8.82 8.58 GJ0357 1 09 36 01.6 −21 39 39 0.995 171.8 28 .11074 .00190 2 63,64 11.27 10.49 7.49 10.92 9.86 8.57 3/ 7.34 6.74 6.48 SCR0939-4300 1 09 39 44.7 −43 00 27 0.393 209.4 1 ... ... ... ... 14.05 12.14 10.30 13.57 12.42 10.93 1/ 9.50 8.87 8.64 GJ0358 1 09 39 46.4 −41 04 03 0.620 302.8 1 .10546 .00162 2 63,64 11.33 9.07 7.78 10.78 9.66 8.27 3/ 6.90 6.32 6.06 LTT03553 1 09 41 21.2 −20 34 41 0.404 270.8 1 ... ... ... ... 13.55 11.18 9.50 12.56 11.52 10.23 /44 8.98 8.28 8.06 G161-066 1 09 42 12.8 −07 01 46 0.405 193.5 1 ... ... ... ... 14.93 12.60 10.47 ... ... ... ... 9.75 9.22 8.92 LHS2177 1 09 42 35.7 −19 14 05 0.545 241.6 1 .06347 .00354 1 64 12.69 10.15 8.66 11.96 10.90 9.60 /69 8.30 7.72 7.50 GJ1128 1 09 42 46.4 −68 53 06 1.125 000.6 1 .15305 .00241 1 29 13.76 11.24 9.02 12.74 11.39 9.65 /29 7.95 7.39c 7.04 LHS5156 1 09 42 49.6 −63 37 56 0.506 084.1 1 .09515 .00117 1 47 14.06 11.69 9.30 13.30 11.98 10.28 /47 8.62 8.10 7.77 LHS0272 1 09 43 46.2 −17 47 06 1.439 279.2 30 .07395 .00118 1 30 14.09 11.61 10.01 13.16 12.10 10.87 /30 9.62 9.12 8.87 WT0244 1 09 44 23.7 −73 58 38 0.517 257.2 1 .04330 .00150 1 47 16.24 14.08 11.49 15.17 13.80 12.02 /47 10.23 9.71 9.38 GJ0367 1 09 44 29.8 −45 46 36 0.745 218.6 28 .10255 .00294 2 63,64 10.28 8.66 7.81 10.12 9.10 7.86 3/ 6.63 6.05 5.78 GJ1129 1 09 44 47.3 −18 12 49 1.597 264.3 30 .09389 .00249 1 30 13.31 10.18 8.56 12.46 11.24 9.67 /30 8.12 7.54 7.26 G161-071 1 09 44 54.2 −12 20 54 0.353 275.7 1 ... ... ... ... 14.54 11.90 9.32 13.76 12.26 10.36 2/ 8.50 7.92 7.60 LP462-119 2 09 45 40.1 −39 02 27 0.307 206.3 1 .04948 .00479 1 64 12.54J 10.30J 8.92J ... ... ... ... 8.37J 7.78J 7.52J WT2458 1 09 45 58.4 −32 53 30 0.355 295.5 1 ... ... ... ... 15.31 12.89 10.43 14.04 12.66 10.89 2/ 9.20 8.60 8.28 LHS2186 1 09 46 09.3 −04 25 43 0.547 287.6 36 ... ... ... ... 15.19 12.78 10.38 ... ... ... ... 9.69 9.15 8.83 GJ2075 2 09 49 27.8 −55 20 09 0.300 126.5 1 .04770 .00184 1 64 10.76 8.60 7.47 10.28J 9.34J 8.33J /34 7.25J 6.57J 6.37J LTT03613 1 09 50 40.5 −13 48 39 0.195 125.5 1 ... ... ... ... 13.25 10.93 8.85 12.71 11.52 9.99 2/ 8.58 7.97 7.72 LTT03612 1 09 50 48.3 −09 07 10 0.230 204.0 37 ... ... ... ... 13.90 11.65 9.67 ... ... ... ... 9.26 8.66 8.38 GJ0369 1 09 51 09.6 −12 19 48 1.850 142.1 28 .07298 .00174 2 63,64 10.49 8.37 6.93 10.06 9.13 8.11 /5 6.99 6.40 6.15 LTT03616 1 09 51 23.3 −17 44 24 0.445 074.4 1 ... ... ... ... 12.45 10.10 8.67 11.84 10.83 9.55 /44 8.30 7.74 7.49 GJ0372 2 09 53 11.8 −03 41 25 0.512 190.7 1 .06220 .00210 2 63,64 11.28J 8.96J 7.78J 10.55J 9.53J 8.29J /5 7.00J 6.41J 6.13J GJ1130 2(1) 09 53 28.1 −31 45 08 0.180 235.2 1 .04145 .00155 1 64 11.06 8.79 8.00 10.15 9.29 8.43 1/ 7.40 6.77 6.57 LTT03629 1 09 53 30.3 −31 28 12 0.235 167.3 1 ... ... ... ... 13.53 11.59 10.05 ... ... ... ... 9.14 8.55 8.32 LP847-048 1 09 55 23.9 −27 15 41 0.185 207.7 1 .08832 .00318 1 64 12.56 10.20 8.43 12.08 10.90 9.44 1/ 8.03 7.43 7.14 GJ0375 2 09 58 34.3 −46 25 30 0.678 138.4 1 .06477 .00172 2 63,64 12.15J 10.07J 8.55J 11.27J 10.11J 8.59J 1/ 7.13J 6.52J 6.26J GJ0377 1 10 01 10.7 −30 23 25 1.273 300.3 28 .06223 .00246 2 63,64 12.51 9.91 8.54 11.44 10.36 8.98 /34 7.60 6.99c 6.70 LP463-104 1 10 01 23.8 −38 50 25 0.272 144.9 1 ... ... ... ... 12.47 10.16 8.62 ... ... ... ... 8.33 7.74c 7.46 LHS5166 2(1) 10 04 38.7 −33 35 10 0.493 137.6 36 .05480 .00560 1 2 15.39 13.01 10.90 14.36 13.08 11.41 2/ 9.85 9.30 9.03 LP903-021 1 10 04 50.6 −31 05 28 0.339 226.8 1 .04349 .00344 1 64 13.08 10.61 9.31 12.00 10.97 9.75 /34 8.46 7.86c 7.62 L319-147 1 10 06 08.7 −49 49 38 0.192 191.7 1 ... ... ... ... 13.06 10.97 9.19 ... ... ... ... 8.89 8.33 8.10 LP789-023 1 10 06 31.9 −16 53 26 0.343 304.4 1 ... ... ... ... 20.10 17.41 13.83 ... ... ... ... 12.04 11.39 10.99

– 45 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

L016-059 2 10 07 09.9 −82 50 16 0.341 300.9 1 ... ... ... ... 12.94J 10.93J 9.17J ... ... ... ... 8.52J 8.14Jc 7.74Jc LP729-033 1 10 08 01.1 −14 36 27 0.394 255.2 1 ... ... ... ... 16.83 14.68 12.04 ... ... ... ... 10.60 10.02 9.67 LP903-035 1 10 10 46.8 −30 46 49 0.389 283.8 1 ... ... ... ... 14.27 12.21 10.50 ... ... ... ... 9.48 8.86 8.59 WT1757 1 10 11 45.0 −24 25 34 0.198 097.2 1 ... ... ... ... 12.13 10.00 8.96 ... ... ... ... 8.17 7.50 7.32 GJ0381 2 10 12 04.7 −02 41 05 0.790 140.3 28 .08352 .00277 2 63,64 11.89J 9.40J 7.74J 10.64J 9.59J 8.32J /5 7.02J 6.47J 6.19J GJ0382 1 10 12 17.7 −03 44 44 0.314 219.0 1 .12611 .00181 2 63,64 10.12 7.61 6.58 9.29 8.28 7.11 /5 5.89 5.26 5.02 LHS2233 1 10 12 59.6 −35 43 59 0.532 292.7 36 ... ... ... ... 13.95 11.77 10.19 13.02 11.86 10.47 /9 9.22 8.58 8.36 GJ1132 1 10 14 51.8 −47 09 24 1.126 291.7 29 .08307 .00169 1 29 13.95 11.93 9.57 13.49 12.26 10.69 /29 9.25 8.67 8.32 G162-037 1 10 16 35.7 −11 56 48 0.277 191.6 1 ... ... ... ... 15.10 13.14 11.28 ... ... ... ... 9.96 9.40 9.13 GJ0386 1 10 16 46.0 −11 57 42 0.726 217.6 1 .07538 .00245 2 63,64 12.08 9.71 8.53 10.51 9.46 8.14 /5 7.32 6.71 6.45 LP790-002 2(1) 10 18 13.9 −20 28 41 0.390 287.2 1 ... ... ... ... 14.90 12.73 10.28 13.95 12.58 10.81 7/ 9.00 8.42 8.15 LTT03780 1 10 18 35.2 −11 43 00 0.396 238.1 1 ... ... ... ... 13.88 12.02 10.40 13.07 11.94 10.44 /44 9.01 8.44c 8.20 L392-039 2(1) 10 19 51.3 −41 48 46 0.442 193.0 1 ... ... ... ... 12.43 10.16 8.68 11.64 10.66 9.52 2/ 8.36 7.72 7.49 WT2473 1 10 21 12.1 −37 05 44 0.355 143.5 1 ... ... ... ... 14.53 12.47 10.30 ... ... ... ... 9.39 8.75 8.47 GJ0389 2 10 22 24.6 −60 10 38 0.531 139.6 28 .05042 .00183 2 63,64 10.92J 8.34J 7.27J 10.72 9.82 8.80 /5 7.71 7.08 6.85 L101-009 1 10 22 46.1 −66 02 26 0.210 290.2 1 ... ... ... ... 14.77 12.79 10.51 ... ... ... ... 9.55 8.98 8.72 L142-086 1 10 24 07.0 −63 59 55 0.347 214.8 1 ... ... ... ... 11.55 8.98 ... 10.62 9.67 8.66 1/ 7.54 6.85 6.66 GJ0390 1 10 25 10.8 −10 13 43 0.709 278.6 1 .08134 .00178 2 63,64 11.31 8.97 7.82 10.17 9.19 8.10 /5 6.90 6.26 6.03 LTT03835 2 10 26 38.3 −16 51 19 0.357 213.6 1 ... ... ... ... 12.28J 10.18J 8.36J ... ... ... ... 8.55J 7.90J 7.69J LTT03855 1 10 30 50.8 −35 46 39 0.334 271.3 1 .04062 .00203 1 64 12.15 9.74 8.46 ... ... ... ... 8.19 7.49 7.29 LTT03538 1 10 31 08.5 −41 27 49 0.286 280.3 1 ... ... ... ... 14.42 11.96 10.04 ... ... ... ... 9.43 8.85 8.61 LP904-068 1 10 33 39.1 −29 00 32 0.287 137.9 1 ... ... ... ... 13.91 11.62 10.12 ... ... ... ... 9.16 8.49 8.24 LEHPM2-4342 1 10 34 24.7 −28 19 19 0.210 266.2 1 ... ... ... ... 13.36 11.18 9.52 ... ... ... ... 8.69 8.06 7.79 LTT03877 1 10 35 01.1 −09 24 39 0.313 133.3 1 ... ... ... ... 12.69 10.37 9.01 12.11 11.02 9.63 /44 8.28 7.68c 7.39 LP904-038 1 10 37 41.6 −29 31 04 0.216 120.8 1 ... ... ... ... 14.44 12.45 11.02 ... ... ... ... 9.64 9.07 8.82 LTT03896 1 10 37 45.3 −27 46 39 0.322 318.4 1 ... ... ... ... 14.30 12.02 9.94 13.14 11.84 10.19 3/ 8.60 8.04c 7.72 LEHPM2-2758 1 10 38 47.8 −86 32 44 0.223 198.2 43 ... ... ... ... 14.08 13.04 10.31 13.24 12.02 10.46 3/ 8.97 8.40 8.11 GJ0399 1 10 39 40.6 −06 55 26 0.756 263.8 1 .06394 .00278 2 63,64 11.51 9.49 7.73 11.31 10.27 8.99 /5 7.66 7.05c 6.82 LP465-084 2 10 39 44.4 −37 55 14 0.241 123.8 1 .07151 .00248 1 64 12.23J 9.85J 8.52J 11.06J 9.94J 8.54J 1/ 7.21J 6.63J 6.38J WT0309 1 10 40 47.5 −44 45 53 0.269 328.0 1 ... ... ... ... 14.56 12.20 10.24 ... ... ... ... 9.50 8.84 8.66 GJ1135 2 10 41 09.3 −36 53 44 0.255 131.7 1 .06121 .00152 1 64 10.86J 8.64J 7.36J 9.94J 9.00J 7.98J /34 6.91J 6.22J 5.99J LP904-051 1 10 41 44.0 −31 11 55 0.455 125.9 1 ... ... ... ... 17.48 15.20 12.73 ... ... ... ... 11.04 10.45 10.16 LP848-050 1 10 42 41.4 −24 16 05 0.205 015.4 1 ... ... ... ... 17.68 15.34 12.09 16.55 14.57 12.47 2/ 10.28 9.67 9.34 WT1827 2 10 43 02.8 −09 12 41 1.959 280.0 29 .08099 .00242 1 29 16.00J 13.80J 10.85J 15.11J 13.57J 11.59J 3/29u 9.67J 9.10J 8.73J LTT03936 1 10 44 09.5 −26 37 44 0.287 261.2 1 ... ... ... ... 13.79 11.54 10.13 ... ... ... ... 9.08 8.48 8.25 LP905-056 1 10 45 16.7 −30 48 27 0.247 185.2 1 .07141 .00237 1 64 12.54 10.08 8.65 11.22 10.21 9.03 /34 7.82 7.22 6.99 LP849-006 1 10 45 51.8 −23 09 01 0.297 237.6 1 ... ... ... ... 16.27 13.95 11.43 ... ... ... ... 10.04 9.49 9.18 LP905-017 1 10 47 11.2 −32 15 06 0.198 264.6 1 ... ... ... ... 13.66 11.41 10.30 ... ... ... ... 9.17 8.51 8.26 LHS2310 1 10 47 38.7 −79 27 46 0.496 242.1 1 ... ... ... ... 14.64 12.71 10.69 13.45 12.19 10.60 3/ 9.05 8.49 8.14 L037-012 1 10 48 01.0 −76 34 16 0.237 293.4 1 ... ... ... ... 15.31 13.45 11.95 ... ... ... ... 9.98 9.43 9.14 DEN1048-3956 1 10 48 12.6 −39 56 07 1.530 229.2 29 .24853 .00118 3 10,12,29 18.75 15.93 12.10 17.37 14.98 12.47 4/29u 9.54 8.91 8.45 LHS0292 1 10 48 14.6 −11 20 10 1.598 159.3 1 .22030 .00360 2 16,63 16.83 14.17 10.40 15.78 13.63 11.25 /16 8.86 8.26 7.93 LHS5179 1 10 53 02.2 −15 05 03 0.482 272.5 1 ... ... ... ... 15.11 12.99 11.32 13.94 12.80 11.31 /44 9.87 9.29 8.99 2MA1054-8505 1 10 54 11.0 −85 05 02 0.465 296.2 15 ... ... ... ... 21.40 19.13 15.99 20.59 18.12 15.64 1/ 12.70 12.07 11.65 LTT04004 1 10 54 42.0 −07 18 33 0.424 203.1 1 ... ... ... ... 14.09 11.98 9.89 13.26 12.03 10.42 1/ 8.88 8.25 7.97 LHS2328 1 10 55 34.5 −09 21 26 0.500 331.0 1 .05384 .00147 1 47 14.12 11.97 9.59 13.55 12.37 10.86 /47 9.42 8.87 8.61 LHS2329 1 10 55 40.1 −52 10 15 0.617 280.6 36 ... ... ... ... 13.47 11.31 9.88 ... ... ... ... 9.13 8.52 8.22 LP731-028 1 10 56 38.9 −15 52 54 0.450 167.0 37 ... ... ... ... 12.97 10.77 9.09 11.82 10.74 9.39 2/ 8.07 7.47 7.23 LTT04030 1 10 58 34.2 −05 54 09 0.249 169.4 1 ... ... ... ... 14.08 11.95 10.08 ... ... ... ... 9.20 8.60 8.33

– 46 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS2335 1 10 58 35.1 −31 08 38 0.551 259.8 1 .05055 .00155 1 47 12.62 10.32 9.29 11.93 10.90 9.63 /47 8.36 7.76 7.47 LP791-023 1 11 04 25.2 −17 48 09 0.441 130.0 1 ... ... ... ... 16.89 14.67 12.34 ... ... ... ... 10.83 10.19 9.87 UPM1104-6232 1 11 04 33.8 −62 32 35 0.243 254.8 1 ... ... ... ... 16.42 14.09 11.48 15.20 13.77 11.96 1/ 10.26 9.68 9.36 L066-047 2(1) 11 04 33.5 −72 57 10 0.256 108.1 1 ... ... ... ... 11.95 10.21 9.34 ... ... ... ... 8.47 7.85c 7.61 LP849-051 1 11 05 06.9 −22 12 52 0.348 189.3 1 ... ... ... ... 17.25 15.04 12.32 ... ... ... ... 10.70 10.14 9.82 LP731-047 1 11 06 56.9 −12 44 03 0.320 267.5 1 ... ... ... ... 19.70 16.91 13.37 ... ... ... ... 11.79 11.19 10.79 L754-040 1 11 07 27.7 −19 17 30 0.220 256.3 1 .05351 .00164 1 64 11.24 9.14 7.90 10.38 9.46 8.52 /34 7.45 6.85c 6.62 L017-069 1 11 07 58.2 −83 51 23 0.298 265.7 1 ... ... ... ... 14.08 12.25 10.81 12.68 11.62 10.31 1/ 9.06 8.45 8.18 GJ0413.1 1 11 09 31.3 −24 35 55 0.892 244.7 1 .09323 .00167 2 63,64 11.12 8.81 7.68 10.44 9.42 8.19 /5 6.95 6.36 6.10 LHS2360 1 11 10 00.5 −74 36 15 0.721 303.2 1 ... ... ... ... 15.03 13.14 11.16 13.57 12.43 10.78 2/ 9.24 8.61c 8.35 SCR1110-3608 1 11 10 29.0 −36 08 25 0.547 266.5 1 ... ... ... ... 17.20 15.07 12.72 15.76 14.38 12.64 /71 10.93 10.34 10.00 GJ0422 1 11 16 00.2 −57 32 52 2.733 294.9 36 .07882 .00249 2 63,64 11.16 9.53 8.05 11.64 10.57 9.17 /5 7.81 7.30c 7.04 L611-120 1 11 16 06.8 −30 10 41 0.338 289.7 1 .04309 .00210 1 64 11.23 8.97 7.89 ... ... ... ... 7.66 7.02 6.81 LP850-015 1 11 16 18.7 −25 49 22 0.265 200.6 1 ... ... ... ... 16.57 14.53 12.26 ... ... ... ... 10.65 10.00 9.69 GJ1144 1 11 16 22.2 −14 41 36 0.222 230.2 1 .05582 .00150 1 64 10.18 8.09 7.12 9.98 9.10 7.40 /44 7.28 6.65 6.46 LHS2386 1 11 16 36.7 −44 07 50 0.519 266.7 1 ... ... ... ... 15.37 13.16 11.07 ... ... ... ... 9.92 9.30 9.05 LHS2385 1 11 16 37.6 −27 57 19 0.940 210.3 1 ... ... ... ... 14.81 12.57 10.33 ... ... ... ... 9.36 8.91 8.62 LP732-015 1 11 17 06.5 −11 22 25 0.424 247.9 1 ... ... ... ... 14.52 12.35 10.31 ... ... ... ... 9.62 8.95 8.73 GJ1145 1 11 17 07.5 −27 48 49 0.234 110.0 1 .05652 .00128 1 64 10.74 8.46 7.51 9.76 8.88 8.07 /34 7.06 6.42 6.20 LP792-053 1 11 19 22.8 −19 00 30 0.214 266.5 1 ... ... ... ... 15.37 12.96 11.00 ... ... ... ... 9.93 9.43 9.14 L467-021 1 11 19 41.1 −36 15 20 0.455 138.4 1 ... ... ... ... 14.63 12.47 10.88 ... ... ... ... 9.64 9.06 8.82 LP792-014 1 11 19 48.2 −16 32 38 0.349 279.9 1 ... ... ... ... 16.71 14.46 11.70 ... ... ... ... 10.65 10.05 9.79 LP792-016 1 11 20 46.5 −19 39 07 0.386 243.0 1 ... ... ... ... 13.83 11.61 9.88 12.87 11.78 10.40 /44 9.08 8.47c 8.21 LP792-017 1 11 20 59.9 −17 01 49 0.253 221.5 1 ... ... ... ... 12.32 10.30 8.64 12.19 11.15 9.85 /44 8.59 7.92 7.70 LHS2397a 2 11 21 49.2 −13 13 09 0.507 264.7 16 .06898 .00112 5 7,16,17,62,63 20.71J 17.95J 14.67J 19.55J 17.27J 14.90J /16 11.93J 11.23J 10.74J LHS2400 1 11 22 42.5 −32 05 40 0.614 175.6 11 .04426 .00228 1 11 17.27 15.43 12.43 16.37 14.82 12.91 /11 11.04 10.52 10.17 LHS2401 1 11 23 57.3 −18 21 49 0.567 261.8 1 .05447 .00251 1 47 14.03 11.82 10.01 13.10 11.97 10.54 /47 9.17 8.59 8.32 SCR1124-3900 1 11 24 23.2 −39 00 43 0.185 168.3 1 ... ... ... ... 15.67 13.65 11.37 14.29 13.05 11.47 1/ 10.00 9.45 9.10 SCR1125-3834 1 11 25 37.3 −38 34 43 0.571 246.8 1 ... ... ... ... 16.04 13.80 11.66 14.57 13.29 11.67 /71 10.09 9.51 9.19 LP792-060 1 11 26 50.8 −18 44 59 0.203 193.6 1 ... ... ... ... 15.51 13.27 11.13 14.50 13.32 11.74 /45 10.11 9.47 9.17 LTT04244 1 11 30 06.9 −30 42 44 0.356 262.9 1 ... ... ... ... 13.92 11.54 9.47 ... ... ... ... 9.31 8.66 8.40 LP672-042 1 11 30 41.8 −08 05 43 0.419 306.6 1 .07575 .00422 1 64 12.41 10.31 8.44 12.06 10.90 9.46 1/ 8.03 7.46 7.15 LHS0306 1 11 31 08.4 −14 57 21 1.432 163.2 29 .08902 .00166 2 29,56 15.11 12.62 10.18 14.19 12.81 11.05 4/29u 9.36 8.76 8.50 GJ0431 1 11 31 46.5 −41 02 47 0.717 290.0 63 .09639 .00234 2 63,64 12.53 9.74 8.30 11.52 10.36 8.87 /5 7.37 6.77 6.51 L540-090 1 11 32 18.4 −35 26 14 0.288 184.7 1 ... ... ... ... 14.27 12.76 10.96 ... ... ... ... 9.46 8.81 8.57 LP792-033 1 11 32 19.0 −16 58 07 0.270 147.1 1 .04385 .00265 1 64 11.60 9.50 8.44 11.42 10.48 9.42 /44 8.28 7.68 7.47 L324-051 1 11 32 22.0 −46 28 30 0.383 282.2 1 ... ... ... ... 13.13 11.14 10.49 12.20 11.13 9.83 1/ 8.55 7.95 7.70 LP850-047 1 11 33 01.9 −23 11 08 0.332 131.4 1 ... ... ... ... 13.96 11.53 10.44 ... ... ... ... 9.33 8.71 8.47 LHS2427 1 11 34 38.0 −23 52 15 0.683 244.2 28 .05606 .00203 2 63,64 12.38 9.75 9.33 11.17 10.22 9.21 /69 8.09 7.48 7.26 L066-086 1 11 34 59.7 −74 36 09 0.434 022.0 1 ... ... ... ... 12.48 10.41 9.37 11.04 10.08 9.00 2/ 7.84 7.20 7.01 GJ0433 1 11 35 27.0 −32 32 24 0.811 184.5 1 .11209 .00143 2 63,64 10.01 7.88 6.76 9.84 8.84 7.69 /5 6.47 5.86 5.62 LP851-027 2 11 36 57.1 −23 29 48 0.245 225.4 1 ... ... ... ... 13.64J 11.47J 9.68J 12.90J 11.79J 10.36J /46 9.35J 8.43J 8.27J SCR1138-7721 1 11 38 16.8 −77 21 49 2.148 286.9 25 .12227 .00292 1 25 16.45 14.12 11.46 14.78 13.20 11.24 /71 9.40 8.89 8.52 GJ1147 1 11 38 25.0 −41 22 33 0.945 272.7 1 .06608 .00108 1 47 14.84 12.48 10.49 13.72 12.49 10.91 /47 9.44 8.86 8.54 LP673-025 1 11 40 18.0 −08 11 27 0.422 242.2 1 ... ... ... ... 13.27 11.27 9.86 ... ... ... ... 9.08 8.44c 8.20 SIP1141-3624 1 11 41 21.5 −36 24 35 0.573 058.3 1 ... ... ... ... 14.23 12.19 10.11 13.10 11.79 10.10 3/ 8.49 7.97 7.70 UPM1142-6440 1 11 42 29.9 −64 40 34 0.295 214.3 1 ... ... ... ... 16.07 14.08 11.42 15.21 13.84 12.06 1/ 10.39 9.85 9.48 GJ0438 1 11 43 19.8 −51 50 26 0.847 129.5 28 .09220 .00203 2 47,63 10.62 7.89 7.12 10.35 9.36 8.27 /47 7.14 6.58 6.32 SCR1144-4302 1 11 44 24.9 −43 02 54 0.311 293.6 1 ... ... ... ... 19.60 17.50 14.39 18.82 16.61 14.41 1/ 12.17 11.56 11.20

– 47 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LP793-033 2(1) 11 45 34.5 −20 21 12 0.202 072.7 1 .05192 .00335 1 64 12.64 10.57 9.38 11.78 10.76 9.53 1/ 8.31 7.71 7.44 SIP1145-4055 1 11 45 35.4 −40 55 59 0.307 244.5 1 ... ... ... ... 15.41 13.13 10.75 ... ... ... ... 9.70 9.10 8.79 GJ0443 1 11 46 42.9 −14 00 52 1.111 137.8 1 .05133 .00304 2 63,64 12.06 9.84 8.45 11.69 10.64 9.28 /5 7.97 7.28 7.07 SCR1147-5504 1 11 47 52.5 −55 04 12 0.192 011.4 1 ... ... ... ... 14.96 12.23 10.25 13.72 12.54 11.06 /71 9.67 9.08 8.81 LHS2460 1 11 48 19.4 −11 17 14 0.754 268.1 1 ... ... ... ... 13.80 11.92 9.84 12.99 11.89 10.47 /44 9.03 8.43c 8.17 LP613-062 1 11 51 55.3 −01 31 32 0.252 136.8 1 ... ... ... ... 16.57 14.19 11.59 15.64 14.23 12.39 /45 10.54 9.99 9.64 LTT04404 1 11 51 55.4 −27 29 10 0.362 198.2 1 ... ... ... ... 12.37 10.23 8.77 ... ... ... ... 8.50 7.88c 7.67 LP961-051 1 11 52 35.6 −35 09 43 0.298 284.9 1 ... ... ... ... 13.89 11.72 10.17 ... ... ... ... 9.39 8.69 8.50 LHS0317 1 11 53 12.4 −31 23 56 1.100 262.8 1 ... ... ... ... 14.65 12.55 10.25 13.65 12.42 10.80 1/ 9.31 8.78 8.56 GJ0452 1 11 53 16.1 −07 22 28 0.538 198.0 63 .05278 .00348 2 63,64 12.38 10.84 8.75 11.86 10.83 9.55 /5 8.30 7.70 7.45 LP961-053 1 11 54 18.4 −37 33 10 0.314 121.2 1 ... ... ... ... 12.48 10.31 9.19 ... ... ... ... 8.48 7.88 7.62 LP851-346 1 11 55 42.9 −22 24 59 0.409 244.0 16 .08954 .00177 1 16 19.35 16.83 13.20 18.18 15.97 13.50 /16 10.93 10.30 9.88 LHS2476 1 11 55 44.3 −18 54 32 0.640 120.1 1 ... ... ... ... 15.24 13.09 10.91 14.25 13.04 11.48 /69 9.97 9.40 9.09 GJ2086 1 11 55 49.2 −38 16 49 0.681 116.9 1 .04109 .00288 1 64 12.90 10.81 9.59 11.96 10.98 9.91 /34 8.77 8.18 7.95 SCR1157-0149 1 11 57 45.6 −01 49 03 0.453 120.1 1 ... ... ... ... 17.29 15.13 12.62 15.99 14.54 12.68 /71 10.91 10.35 10.02 LP851-399 1 11 57 53.5 −23 49 01 0.254 259.3 1 ... ... ... ... 15.76 13.55 11.31 14.77 13.51 11.84 /46 10.22 9.62 9.36 RXJ1159-5247 1 11 59 27.4 −52 47 19 1.110 264.8 1 ... ... ... ... 21.00 17.64 13.74 19.14 16.92 14.49 3/ 11.43 10.76 10.32 L325-274 1 12 00 22.9 −49 31 14 0.387 274.9 1 ... ... ... ... 13.07 10.71 8.83 ... ... ... ... 8.68 8.08 7.87 LHS5205 2 12 00 36.9 −13 49 36 0.483 264.4 1 ... ... ... ... 13.18J 11.19J 9.28J 12.74J 11.59J 10.11J /66 8.85 8.22 7.93 L829-010 2 12 01 40.8 −12 13 54 0.238 191.3 1 ... ... ... ... 13.10J 11.16J 9.54J 12.34J 11.30J 9.96J /66 8.69 8.10 7.87 GJ2088 2 12 02 13.2 −38 00 29 0.282 207.3 1 .04363 .00192 1 64 11.46J 9.17J 8.12J 10.52J 9.60J 8.65J /34 7.61J 6.95J 6.78J LP794-013 1 12 02 16.9 −16 22 04 0.303 276.9 1 ... ... ... ... 14.02 11.97 10.21 ... ... ... ... 9.28 8.65 8.38 LP908-010 1 12 03 28.1 −29 23 00 0.320 313.0 37 ... ... ... ... 16.70 13.65 11.70 15.36 14.04 12.36 1/ 10.74 10.13 9.81 SIP1203-4023 1 12 03 51.3 −40 23 42 0.332 286.9 1 ... ... ... ... 16.15 14.08 11.63 ... ... ... ... 10.24 9.69 9.40 LHS2506 1 12 03 58.3 −33 01 27 0.750 273.1 1 ... ... ... ... 14.94 12.70 10.62 ... ... ... ... 9.53 9.07 8.74 LP852-005 2(1) 12 05 12.9 −25 33 54 0.301 133.2 1 ... ... ... ... 13.89 11.71 10.04 13.10 12.02 10.65 /44 9.27 8.66 8.40 L397-071 1 12 06 39.1 −44 27 54 0.388 142.6 1 ... ... ... ... 13.46 11.37 9.51 ... ... ... ... 8.68 8.08 7.83 SCR1206-3500 1 12 06 58.5 −35 00 52 0.403 225.7 1 ... ... ... ... 15.55 13.46 11.19 14.67 13.35 11.66 /71 10.01 9.40 9.13 GJ0456 1 12 08 22.2 −00 28 58 0.965 264.7 28 .04022 .00249 2 63,64 12.34 9.92 9.37 11.28 10.38 9.50 /69 8.40 7.81 7.59 LP734-030 1 12 08 47.1 −10 16 00 0.389 230.0 1 ... ... ... ... 13.39 11.39 9.63 12.65 11.60 10.27 /44 8.96 8.30 8.04 SCR1209-3815 1 12 09 23.6 −38 15 43 0.254 207.9 1 ... ... ... ... 16.38 14.15 11.82 15.05 13.69 11.95 1/ 10.33 9.75 9.45 LP908-025 1 12 09 54.1 −29 20 16 0.272 132.8 1 ... ... ... ... 16.15 14.12 11.62 14.72 13.49 11.85 /45 10.22 9.64 9.34 LHS2520 1 12 10 05.6 −15 04 17 0.719 184.5 1 .07793 .00241 1 47 12.89 10.76 8.82 12.09 10.88 9.30 /47 7.77 7.14 6.86 LHS2521 1 12 10 11.6 −31 58 24 0.588 261.6 1 ... ... ... ... 17.87 15.69 13.00 ... ... ... ... 11.11 10.53 10.22 LP734-034 1 12 10 28.4 −13 10 24 0.444 145.5 1 ... ... ... ... 14.66 12.52 10.46 13.83 12.52 10.85 1/ 9.29 8.68 8.41 SCR1210-2213 2 12 10 42.2 −22 13 09 0.285 038.2 1 ... ... ... ... 13.56J 11.41J 9.92J 13.05J 11.91J 10.43J 1/ 9.03 8.66 8.37 L758-108 2(1) 12 11 11.8 −19 57 38 0.260 227.9 1 .07943 .00236 1 64 12.50 10.32 8.72 11.68 10.59 9.22 /67 7.90 7.36 7.04 LP852-057 1 12 13 32.9 −25 55 25 0.433 137.3 1 .04271 .00203 1 64 12.24 10.09 8.98 11.47 10.51 9.49 /34 8.38 7.74 7.55 SCR1214-4603 1 12 14 40.0 −46 03 14 0.750 250.8 60 ... ... ... ... 16.80 14.53 11.60 15.66 14.14 12.23 /71 10.32 9.75 9.44 SCR1217-7810 1 12 17 26.9 −78 10 46 0.212 056.7 1 ... ... ... ... 17.55 15.69 13.15 16.43 14.92 13.05 /71 11.20 10.64 10.36 LP674-104 1 12 18 34.9 −06 25 23 0.379 263.3 1 ... ... ... ... 14.89 12.72 10.74 ... ... ... ... 9.55 8.97 8.71 LP052-034 1 12 19 48.8 −23 32 05 0.198 262.6 1 ... ... ... ... 16.58 14.36 11.69 ... ... ... ... 10.49 9.90 9.58 LP794-053 1 12 20 05.1 −18 13 00 0.228 280.4 1 ... ... ... ... 16.77 14.40 11.94 ... ... ... ... 10.56 9.99 9.62 L018-022 1 12 20 33.8 −82 25 58 0.273 004.5 1 ... ... ... ... 12.89 10.74 9.10 11.96 10.76 9.20 3/ 7.70 7.14 6.84 L038-047 1 12 22 06.8 −78 38 27 0.397 241.8 1 ... ... ... ... 13.08 10.97 9.36 12.13 11.04 9.69 1/ 8.36 7.75 7.48 GJ1157 1 12 23 01.4 −46 37 09 0.848 245.3 1 .06242 .00063 1 47 14.39 12.19 9.94 13.59 12.35 10.71 /47 9.17 8.63 8.36 2MA1223-4606 2 12 23 38.6 −46 06 20 0.214 264.6 1 ... ... ... ... 14.94J 12.43J 10.89J ... ... ... ... 9.53J 8.94J 8.70J LHS0325a 1 12 23 56.2 −27 57 46 1.293 284.4 36 ... ... ... ... 19.35 17.15 14.15 18.39 16.42 14.20 /24 11.98 11.40 11.07 SCR1224-5339 1 12 24 24.4 −53 39 09 0.217 257.2 1 ... ... ... ... 16.52 14.04 11.50 15.31 13.95 12.19 /71 10.51 9.93 9.65

– 48 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

GJ0465 1 12 24 52.2 −12 38 36 2.553 154.4 29 .11167 .00168 3 29,63,64 12.14 9.92 8.30 11.27 10.23 8.97 2/29u 7.73 7.25 6.95 BRI1222-1222 1 12 24 52.5 −18 14 32 0.353 230.4 1 .05860 .00380 1 62 21.83 18.58 15.26 20.41 18.01 15.60 /16 12.57 11.82 11.35 LHS2557 1 12 25 32.0 −15 59 42 0.826 272.9 36 ... ... ... ... 15.77 13.65 11.21 15.19 13.76 11.85 /45 9.95 9.36 9.00 LP735-048 1 12 26 44.1 −12 29 18 0.196 242.5 1 ... ... ... ... 12.82 10.54 8.85 12.59 11.49 10.08 /44 8.87 8.12 7.87 LP852-050 1 12 27 02.2 −25 45 01 0.394 227.3 1 ... ... ... ... 16.92 14.75 12.25 ... ... ... ... 10.84 10.27 9.93 LP735-011 2 12 28 53.0 −10 39 51 0.274 267.7 1 ... ... ... ... 10.88J 8.87J 7.35J 10.97J 9.93J 8.67J 1/ 7.65 7.19c 6.79 GJ1158 1 12 29 34.5 −55 59 37 1.164 228.9 1 .07618 .00138 1 30 14.53 12.41 10.30 13.26 12.02 10.41 /30 8.89 8.35 8.07 LHS2567 2 12 29 54.2 −05 27 24 0.660 243.8 1 .04768a .00129 2 47,47 12.75J 10.73J 8.72J 13.08 11.87 10.33 /47 8.82 8.27c 7.96 SCR1230-3411 2 12 30 01.8 −34 11 24 0.529 234.4 1 ... ... ... ... 15.29J 13.18J 10.92J 14.16J 12.81J 11.07J /71 9.34J 8.77Jc 8.44J L194-073 1 12 30 16.6 −57 37 20 0.228 266.0 1 ... ... ... ... 14.93 12.83 11.00 ... ... ... ... 9.69 9.03 8.79 L327-030 1 12 30 44.9 −46 22 43 0.400 269.8 1 ... ... ... ... 12.04 9.85 8.63 ... ... ... ... 8.37 7.72 7.49 LP735-016 1 12 32 44.5 −15 30 55 0.268 218.7 1 ... ... ... ... 18.14 15.85 13.47 ... ... ... ... 11.38 10.85 10.46 L327-121 1 12 33 33.1 −48 26 11 0.267 284.7 1 ... ... ... ... 13.07 10.94 8.99 12.05 10.90 9.43 1/ 8.01 7.38 7.14 LP735-019 1 12 34 44.5 −10 47 41 0.347 251.3 1 ... ... ... ... 15.12 12.88 11.10 ... ... ... ... 9.92 9.31 9.05 GJ0477 2 12 35 58.4 −45 56 21 0.706 188.7 28 .05465 .00293 2 63,64 11.62J 9.64J 8.01J 11.12J 10.12J 8.93J /5 7.67J 7.03J 6.84J LP795-038 1 12 37 21.6 −20 52 36 0.428 183.8 1 ... ... ... ... 14.05 11.78 9.83 13.28 12.10 10.54 /44 8.97 8.32 8.09 LHS5221 1 12 37 21.7 −32 00 37 0.498 151.1 36 ... ... ... ... 16.17 13.84 11.10 ... ... ... ... 10.17 9.61 9.29 GJ0479 1 12 37 52.2 −52 00 06 1.077 270.6 1 .10419 .00224 2 63,64 11.57 9.31 7.53 10.66 9.57 8.21 2/ 6.86 6.29 6.02 2MA1238-2703 1 12 38 37.1 −27 03 35 0.249 219.9 1 ... ... ... ... 13.44 11.34 9.79 ... ... ... ... 8.73 8.08 7.84 GJ1162 1 12 38 47.3 −04 19 17 0.765 253.7 1 .05070 .00310 1 63 14.59 11.99 10.07 13.56 12.37 10.82 /44 9.33 8.76 8.46 LHS0337 1 12 38 49.1 −38 22 54 1.464 206.4 25 .15678 .00199 1 25 13.67 11.44 9.08 12.75 11.44 9.74 /25 8.17 7.76c 7.39 LP735-024 1 12 38 52.2 −10 02 40 0.350 278.7 1 ... ... ... ... 15.26 13.07 11.13 ... ... ... ... 9.98 9.43 9.13 CE258 1 12 39 17.5 −34 27 25 0.233 251.7 1 ... ... ... ... 15.83 13.67 11.87 ... ... ... ... 10.30 9.75 9.48 LHS2597 1 12 39 36.4 −26 58 11 0.594 251.3 1 ... ... ... ... 16.68 14.28 11.42 ... ... ... ... 10.04 9.58 9.23 GJ0480.1 1 12 40 46.3 −43 33 59 1.048 312.0 63 .12557 .00383 2 63,64 13.10 10.57 8.79 12.24 11.06 9.58 2/ 8.22 7.70 7.41 SCR1240-8116 1 12 40 56.0 −81 16 31 0.476 279.3 1 ... ... ... ... 15.15 13.12 11.25 14.11 12.89 11.28 /71 9.73 9.16 8.89 SCR1241-4655 1 12 41 03.3 −46 55 23 0.260 259.3 1 ... ... ... ... 12.84 10.44 9.07 12.14 11.12 9.89 1/ 8.68 8.09c 7.81 LHS5224 1 12 41 26.6 −56 42 00 0.499 270.6 36 ... ... ... ... 13.22 11.37 9.87 ... ... ... ... 8.97 8.27 8.02 LHS2608 1 12 42 19.7 −71 38 20 0.706 269.2 36 ... ... ... ... 14.03 12.42 10.50 ... ... ... ... 9.17 8.54c 8.22 LP796-001 1 12 43 58.9 −16 14 35 0.428 280.0 1 ... ... ... ... 15.85 13.66 11.23 ... ... ... ... 9.78 9.20 8.90 LHS5226 1 12 44 00.7 −11 10 30 0.501 250.8 1 ... ... ... ... 15.40 13.22 10.94 14.19 12.85 11.13 1/ 9.52 8.97 8.67 LP736-031 1 12 44 31.0 −11 42 15 0.281 227.9 1 ... ... ... ... 15.33 13.31 11.19 ... ... ... ... 9.93 9.38 9.07 LTT04866 1 12 44 37.6 −41 55 38 0.374 261.0 1 ... ... ... ... 12.19 9.89 8.94 ... ... ... ... 8.45 7.88 7.67 SCR1245-5506 1 12 45 52.5 −55 06 50 0.413 107.0 1 ... ... ... ... 14.84 12.82 10.34 13.66 12.32 10.61 /71 8.99 8.43 8.12 LP796-006 1 12 46 59.8 −19 02 30 0.261 207.4 1 ... ... ... ... 13.08 10.94 9.60 ... ... ... ... 8.73 8.05 7.81 LHS2634 1 12 47 09.8 −03 34 18 0.499 264.4 1 ... ... ... ... 13.36 11.02 9.60 12.60 11.51 10.11 3/ 8.77 8.16 7.89 LP853-034 1 12 47 10.0 −22 22 37 0.272 259.0 1 ... ... ... ... 13.30 10.97 9.53 12.29 11.25 9.99 /44 8.69 8.10 7.84 SCR1247-0525 1 12 47 14.7 −05 25 13 0.725 320.9 1 ... ... ... ... 15.90 13.38 10.92 14.78 13.45 11.73 3/71u 10.13 9.62 9.29 LHS5228 1 12 47 46.9 −08 36 17 0.498 225.6 36 ... ... ... ... 12.98 10.78 9.73 ... ... ... ... 8.85 8.22 8.00 GJ0488 1 12 50 43.6 −00 46 05 0.420 170.5 1 .09430 .00081 2 63,64 9.24 7.40 6.26 8.47 7.59 6.75 /33 5.75 5.22c 4.88 DEN1250-2121 1 12 50 52.7 −21 21 14 0.526 128.6 1 .05777 .00172 1 16 19.40 16.95 13.34 18.36 16.15 13.78 /16 11.16 10.55 10.13 LP909-045 1 12 52 16.8 −32 27 08 0.293 214.9 1 ... ... ... ... 12.88 10.92 9.71 ... ... ... ... 8.87 8.18 8.02 LTT04925 1 12 53 19.4 −05 19 53 0.389 240.0 37 ... ... ... ... 13.71 11.52 9.94 ... ... ... ... 8.92 8.37 8.12 L256-005 1 12 53 47.8 −50 49 35 0.385 281.2 1 ... ... ... ... 13.57 11.85 10.22 ... ... ... ... 9.19 8.57 8.35 LP736-015 1 12 56 02.1 −12 57 22 0.335 235.7 1 ... ... ... ... 18.86 16.35 12.56 ... ... ... ... 11.02 10.47 10.04 LP854-003 1 12 56 13.3 −22 04 59 0.364 224.3 1 ... ... ... ... 13.04 10.79 9.28 12.54 11.47 10.16 /44 8.87 8.33 8.05 SIP1259-4336 1 12 59 04.8 −43 36 25 1.133 104.0 14 ... ... ... ... 19.02 16.71 12.80 18.01 15.74 13.29 3/ 10.53 9.95 9.52 LHS5231 1 12 59 18.2 −00 10 33 0.482 162.4 36 ... ... ... ... 13.81 11.84 9.87 12.93 11.77 10.24 1/ 8.79 8.23c 7.92 LP854-057 1 12 59 41.7 −26 50 16 0.184 264.8 1 ... ... ... ... 14.85 12.69 10.78 ... ... ... ... 9.64 9.07 8.78

– 49 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LTT04969 1 13 00 04.0 −05 37 48 0.341 275.4 1 ... ... ... ... 13.42 11.07 9.62 12.57 11.45 10.01 /44 8.66 8.04 7.78 L256-025 1 13 00 43.3 −52 09 41 0.185 128.7 1 ... ... ... ... 13.03 11.02 9.64 ... ... ... ... 8.77 8.13 7.94 LHS2668 1 13 01 19.7 −63 11 42 0.595 225.5 1 .05819 .00237 2 63,64 11.90 9.90 8.68 10.93 9.96 8.90 /34 7.76 7.15 6.93 LP910-013 1 13 06 12.2 −29 56 35 0.443 273.3 1 ... ... ... ... 14.27 12.63 10.47 ... ... ... ... 9.54 8.98 8.66 LTT05031 1 13 08 51.2 −01 31 08 0.403 271.0 37 ... ... ... ... 13.56 11.56 9.68 12.77 11.67 10.28 /44 8.92 8.34 8.08 LHS0346 1 13 09 20.4 −40 09 27 1.224 141.9 1 .06175 .00112 1 29 13.34 11.08 9.20 12.86 11.73 10.24 /29 8.79 8.24 7.99 CE303 1 13 09 21.9 −23 30 36 0.378 177.4 1 .06933 .00133 1 16 20.41 17.91 14.51 19.37 17.00 14.58 /16 11.79 11.08 10.67 SCR1311-4619 1 13 11 49.3 −46 19 17 0.276 234.4 1 ... ... ... ... 15.12 12.97 10.74 14.35 13.14 11.58 1/ 10.06 9.41 9.15 LTT05056 1 13 12 31.7 −27 02 23 0.217 223.9 1 ... ... ... ... 13.98 11.88 10.06 ... ... ... ... 9.31 8.65 8.54 WT0392 1 13 13 09.3 −41 30 40 1.028 271.7 29 .08358 .00158 1 29 13.53 11.26 9.13 12.90 11.60 9.95 2/29u 8.29 7.68 7.41 LP617-021 1 13 15 18.5 −02 49 52 0.268 136.0 1 ... ... ... ... 15.43 13.41 11.30 ... ... ... ... 9.82 9.27 9.00 LHS2707 1 13 16 04.2 −55 16 42 0.556 253.3 1 ... ... ... ... 13.24 11.03 9.83 ... ... ... ... 9.07 8.47c 8.21 LHS2704 1 13 16 16.5 −73 08 35 0.500 250.0 38 ... ... ... ... 13.87 11.95 10.11 13.11 11.99 10.58 /40 9.25 8.64 8.40 LP737-014 1 13 16 45.4 −12 20 20 0.300 261.4 1 ... ... ... ... 14.52 12.23 10.33 ... ... ... ... 9.49 8.91 8.64 LTT05105 1 13 18 19.0 −46 47 30 0.305 257.2 1 ... ... ... ... 14.17 11.90 10.10 ... ... ... ... 9.36 8.77c 8.54 LP617-030 1 13 19 29.1 −03 21 40 0.254 243.0 1 ... ... ... ... 14.45 12.48 10.92 ... ... ... ... 9.66 9.03 8.79 L401-070 1 13 19 32.6 −42 45 30 0.331 239.0 38 ... ... ... ... 13.12 10.86 9.32 ... ... ... ... 8.62 8.02c 7.76 LHS2718 1 13 20 03.9 −35 24 44 0.962 241.1 47 .07304 .00079 1 47 14.02 11.84 10.04 12.84 11.70 10.24 /47 8.83 8.25 7.98 L977-016 2(1) 13 20 24.9 −01 39 27 0.290 150.0 1 .04642 .00324 1 64 12.54 10.20 9.15 11.57 10.61 9.51 2/ 8.39 7.79 7.53 LP737-051 1 13 21 54.1 −14 24 10 0.218 287.1 1 ... ... ... ... 15.00 12.81 10.53 ... ... ... ... 9.82 9.29 8.99 L257-129 1 13 22 04.7 −55 00 59 0.279 239.5 1 ... ... ... ... 14.78 12.47 10.49 ... ... ... ... 9.30 8.68 8.43 LHS2729 1 13 23 38.0 −25 54 45 0.643 244.8 1 .07148 .00153 1 47 13.85 11.59 9.45 12.89 11.68 10.14 /49 8.66 8.07c 7.78 G014-052 1 13 24 46.5 −05 04 20 0.328 166.7 1 ... ... ... ... 15.10 13.10 11.04 13.88 12.62 10.98 1/ 9.47 8.86 8.56 GJ0510 1 13 25 48.9 −28 22 26 0.444 260.9 1 .05981 .00236 2 63,64 11.96 9.89 8.12 11.00 10.01 8.86 /5 7.72 7.13 6.88 LHS2739 2 13 27 19.6 −31 10 40 0.587 254.5 1 .05010 .00250 1 55 14.66J 12.41J 10.38J 13.58J 12.38J 16.35J /44 9.33J 8.77Jc 8.52J LP855-014 1 13 27 54.0 −26 57 01 0.212 241.0 1 .04743 .00281 1 64 13.02 11.12 9.37 11.78 10.78 8.60 /34 8.38 7.76c 7.54 GJ0512 2(1) 13 28 21.1 −02 21 37 0.520 167.4 1 .07284 .00270 2 63,64 11.68 9.62 7.94 11.35 10.27 8.89 1/ 7.52 6.91c 6.61 LP677-097 1 13 28 24.2 −03 59 13 0.183 267.5 1 ... ... ... ... 13.29 11.34 10.15 ... ... ... ... 8.98 8.31 8.10 2MA1328-3654 1 13 28 32.9 −36 54 23 0.202 266.7 1 ... ... ... ... 15.36 13.07 11.11 ... ... ... ... 9.83 9.26 9.03 LHS2743 1 13 30 25.8 −52 02 40 0.653 237.5 1 ... ... ... ... 13.82 11.90 10.05 ... ... ... ... 9.15 8.57 8.31 LEP1330-2039 1 13 30 40.9 −20 39 03 0.599 149.7 1 ... ... ... ... 12.64 10.41 8.62 12.46 11.27 9.75 2/ 8.28 7.65 7.39 LP855-025 1 13 31 27.4 −23 04 57 0.263 198.5 1 ... ... ... ... 13.61 11.63 10.00 ... ... ... ... 9.16 8.52 8.30 LP911-026 1 13 32 55.8 −29 16 20 0.224 259.7 1 ... ... ... ... 17.23 15.03 12.15 ... ... ... ... 10.57 10.02 9.68 LHS2758 1 13 34 23.6 −26 22 12 0.775 242.3 1 ... ... ... ... 15.13 13.00 10.92 ... ... ... ... 9.58 9.02 8.75 L330-100 1 13 35 11.5 −48 21 26 0.395 112.2 1 ... ... ... ... 11.91 9.41 8.82 ... ... ... ... 8.12 7.52 7.30 LP330-008 1 13 36 23.1 −45 56 16 0.460 239.0 38 ... ... ... ... 12.40 10.16 9.73 ... ... ... ... 8.22 7.57 7.33 2MA1338-2516 2 13 38 25.6 −25 16 47 0.322 256.0 1 ... ... ... ... 13.02J 11.06J 9.62J ... ... ... ... 8.66J 8.03J 7.78J LTT05282 1 13 38 53.4 −02 15 47 0.313 258.5 1 ... ... ... ... 13.09 10.34 9.78 12.12 11.08 9.81 /70 8.60 8.01 7.75 L906-011 1 13 38 58.7 −06 14 13 0.207 157.9 1 .04243 .00221 1 64 11.60 9.53 8.57 10.72 9.82 8.93 /34 7.89 7.27 7.06 LP678-016 1 13 38 59.7 −06 44 36 0.415 229.0 1 ... ... ... ... 15.31 13.13 11.23 ... ... ... ... 10.02 9.41 9.14 GJ0521.1 1 13 40 07.1 −04 11 10 0.641 324.0 1 .06774 .00116 2 63,64 10.41 8.13 7.51 9.63 8.76 7.92 /5 6.90 6.25c 6.04 LTT05298 1 13 40 45.5 −31 10 15 0.304 229.6 1 ... ... ... ... 13.91 11.59 10.30 ... ... ... ... 9.15 8.46 8.22 LHS2783 1 13 42 09.9 −16 00 23 0.510 268.5 36 ... ... ... ... 13.57 11.55 9.59 13.42 12.14 10.52 2/ 8.97 8.39 8.09 SCR1343-4002 1 13 43 41.5 −40 02 29 0.242 117.8 1 ... ... ... ... 16.44 14.05 11.37 15.07 13.69 11.89 1/ 10.14 9.61 9.25 LP855-060 1 13 44 20.9 −26 18 35 0.364 237.1 1 ... ... ... ... 14.51 12.48 10.42 ... ... ... ... 9.15 8.61c 8.29 LP798-029 1 13 44 37.1 −19 54 44 0.389 244.2 1 ... ... ... ... 14.72 12.71 10.71 ... ... ... ... 9.56 8.97 8.72 GJ0524 1 13 44 48.8 −54 07 18 0.452 213.7 1 ... ... ... ... 13.72 11.15 9.11 12.46 11.40 10.12 /5 8.86 8.30 8.07 LHS2794 1 13 45 50.7 −17 58 06 0.595 206.2 1 .09762 .00503 1 64 13.02 10.43 8.88 11.86 10.69 9.19 /69 7.75 7.19 6.90 LP911-056 1 13 46 46.0 −31 49 26 0.366 294.9 1 ... ... ... ... 18.78 16.52 13.17 ... ... ... ... 10.98 10.44 10.04

– 50 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS2804 1 13 48 40.8 −05 17 08 0.526 152.6 1 ... ... ... ... 15.89 13.67 11.53 ... ... ... ... 10.33 9.70 9.40 UPM1349-4228 1 13 49 01.0 −42 31 10 0.183 242.4 21 ... ... ... ... 14.73 13.76 13.35 13.27 12.16 10.78 1/ 9.45 8.86 8.62 L039-039 1 13 49 02.5 −79 25 54 0.375 280.4 1 ... ... ... ... 12.48 10.24 8.79 11.70 10.70 9.52 1/ 8.34 7.69c 7.39 L691-021 2(1) 13 50 23.8 −21 37 20 0.368 176.1 1 ... ... ... ... 14.83 12.80 10.68 13.61 12.41 10.90 /67 9.46 8.86 8.63 LHS2813 1 13 51 21.8 −53 32 46 0.568 137.6 1 ... ... ... ... 14.28 12.00 10.00 12.84 11.73 10.32 1/ 8.93 8.38 8.12 LP798-049 1 13 51 57.1 −17 58 49 0.222 263.2 1 ... ... ... ... 17.11 15.14 12.82 ... ... ... ... 10.82 10.21 9.93 LP798-051 1 13 52 53.5 −18 20 17 0.290 242.3 1 .04293 .00325 1 64 12.76 10.67 9.31 11.80 10.80 9.65 /44 8.46 7.87 7.61 LHS2822 1 13 53 55.6 −20 14 43 0.545 057.1 1 ... ... ... ... 13.65 11.45 9.80 ... ... ... ... 9.03 8.46 8.21 2MA1354-7121 1 13 54 53.9 −71 21 48 0.212 231.2 20 ... ... ... ... 12.60 10.67 8.75 12.28 11.19 9.86 1/ 8.55 7.92 7.67 GJ1181 2 13 55 02.6 −29 05 26 0.277 253.9 1 .05793 .00148 1 64 10.72J 8.65J 7.49J 9.52J 8.60J 7.64J /34 6.52J 5.84J 5.64J L070-053 1 13 55 28.0 −73 29 41 0.377 294.2 1 ... ... ... ... 11.98 10.27 9.17 11.36 10.40 9.30 1/ 8.18 7.58 7.35 LTT05425 1 13 55 35.1 −07 23 17 0.273 113.0 1 ... ... ... ... 13.31 11.23 9.61 ... ... ... ... 8.81 8.23 7.95 LHS2826 1 13 56 20.6 −28 03 50 0.472 256.0 1 ... ... ... ... 16.26 14.23 12.03 15.26 13.87 12.14 /11 10.48 9.88 9.57 LP475-052 2(1) 13 57 14.0 −38 32 28 0.267 228.0 38 ... ... ... ... 13.39 11.24 9.80 ... ... ... ... 9.18 8.52 8.27 SSS1358-3938 1 13 58 05.4 −39 37 55 1.952 117.1 54 ... ... ... ... 15.14 12.63 10.27 14.04 12.80 11.20 2/ 9.72 9.23 8.95 LP739-002 1 13 58 16.2 −12 02 59 0.345 275.3 1 ... ... ... ... 14.94 12.78 10.48 14.46 13.10 11.39 2/ 9.73 9.17 8.89 LP739-003 1 13 58 19.6 −13 16 25 0.364 102.5 1 ... ... ... ... 14.64 12.39 10.23 13.96 12.71 11.08 /44 9.49 8.93 8.65 LHS2836 1 13 59 10.4 −19 50 04 0.589 247.3 1 .09286 .00089 1 47 13.98 11.69 9.52 12.88 11.60 9.90 /49 8.33 7.76c 7.45 SIP1400-4109 1 14 00 49.7 −41 09 54 0.251 214.8 1 ... ... ... ... 16.24 13.96 11.44 ... ... ... ... 10.29 9.71 9.45 GJ0536 1 14 01 03.2 −02 39 18 1.046 303.3 1 .09973 .00151 2 63,64 10.06 7.95 6.29 9.68 8.73 7.65 /5 6.52 5.94 5.68 LHS2848 1 14 02 28.9 −21 00 37 0.639 127.0 1 ... ... ... ... 14.32 12.21 10.33 13.19 12.04 10.56 /69 9.16 8.60 8.25 LHS2852 1 14 02 46.7 −24 31 50 0.506 315.6 1 ... ... ... ... 13.32 10.53 9.55 12.13 11.08 9.85 2/ 8.64 8.10 7.84 LP912-046 1 14 04 03.2 −30 00 47 0.250 167.0 1 ... ... ... ... 14.53 12.60 10.80 ... ... ... ... 9.46 8.83 8.62 L106-015 1 14 04 08.2 −66 14 38 0.470 076.0 38 ... ... ... ... 14.01 11.98 10.61 11.59 10.51 9.14 2/ 7.78 7.15 6.92 LP912-048 1 14 05 36.9 −32 08 39 0.227 156.8 1 ... ... ... ... 16.88 14.68 12.45 ... ... ... ... 10.70 10.02 9.80 LP679-084 1 14 06 39.3 −05 43 29 0.198 271.1 1 ... ... ... ... 14.80 12.72 10.50 ... ... ... ... 9.57 8.96 8.68 LP912-052 1 14 08 41.0 −28 01 04 0.397 236.8 1 ... ... ... ... 16.76 14.63 12.50 ... ... ... ... 10.78 10.19 9.87 LTT05526 1 14 09 36.5 −41 22 28 0.393 244.7 1 ... ... ... ... 15.12 13.08 11.09 ... ... ... ... 9.83 9.26 8.99 L548-010 1 14 10 57.5 −31 17 25 0.322 305.6 1 .05958 .00206 1 64 12.06 9.93 8.43 10.83 9.85 8.73 /34 7.55 6.94 6.69 WT0460 2 14 11 59.9 −41 32 21 0.693 265.4 1 .10741 .00152 1 25 16.85J 13.97J 11.59J 15.65J 13.91J 11.80J 5/25u 9.67J 9.04J 8.62J LHS2875 2(1) 14 12 11.0 −00 35 04 0.746 290.8 1 .04020 .00340 1 63 13.31 11.33 9.61 13.04 11.96 10.62 /6 9.35 8.79 8.55 GJ0540.2 1 14 13 04.9 −12 01 27 0.669 235.0 1 ... ... ... ... 14.89 12.61 10.45 13.89 12.52 10.79 3/ 9.04 8.45 8.16 GJ2106 1 14 13 12.9 −56 44 32 0.353 068.7 1 .08562 .00194 1 64 11.47 9.36 8.91 10.19 9.21 8.11 /34 6.95 6.39 6.14 LP739-036 1 14 15 46.4 −13 29 34 0.430 251.6 1 ... ... ... ... 13.13 10.98 9.47 ... ... ... ... 8.96 8.34 8.11 L404-216 1 14 16 47.5 −44 53 21 0.409 286.7 1 ... ... ... ... 12.63 10.34 8.37 ... ... ... ... 8.33 7.71 7.45 L404-010 1 14 17 25.9 −40 18 15 0.381 273.3 1 ... ... ... ... 13.48 11.30 9.71 ... ... ... ... 8.63 8.09 7.81 LP619-064 1 14 17 59.1 −00 31 29 0.382 226.0 37 ... ... ... ... 13.86 11.99 10.23 ... ... ... ... 9.04 8.50 8.28 GJ0543 1 14 19 11.0 −07 18 12 1.355 235.5 36 .05190 .00440 1 63 14.01 11.53 9.82 13.48 12.39 10.99 /5 9.67 9.23 8.92 GJ0545 1 14 20 07.4 −09 37 13 1.023 217.7 1 .07140 .00130 3 29,57,63 13.94 11.48 9.94 12.84 11.69 10.15 /29 8.74 8.19 7.98 SCR1420-7516 1 14 20 36.8 −75 16 06 0.194 243.8 1 ... ... ... ... 14.23 12.68 10.45 13.78 12.55 10.95 /71 9.44 8.91 8.63 LHS2899 1 14 21 15.1 −01 07 20 0.670 162.5 1 .07466 .00215 1 47 14.30 12.20 10.20 13.12 11.92 10.39 /47 8.95 8.39 8.09 LP913-013 1 14 21 49.0 −31 54 35 0.329 206.2 1 ... ... ... ... 14.31 12.12 10.26 12.85 11.79 10.47 /44 9.14 8.58 8.31 GJ2107 1 14 23 06.4 −68 22 58 0.241 163.8 1 .04261 .00147 1 64 11.20 8.98 8.82 10.21 9.33 8.46 1/ 7.42 6.82 6.56 LHS2906 1 14 23 07.8 −22 17 09 0.531 208.8 1 ... ... ... ... 16.13 14.13 12.00 14.98 13.70 12.03 1/ 10.40 9.79 9.50 LP800-058 1 14 25 13.3 −16 24 56 0.371 276.0 1 ... ... ... ... 18.46 16.06 13.13 ... ... ... ... 11.48 10.90 10.49 LP740-010 1 14 25 34.1 −11 48 52 0.335 272.1 1 ... ... ... ... 14.41 12.22 10.48 ... ... ... ... 9.35 8.70 8.39 LP620-012 1 14 26 36.8 −01 15 23 0.205 238.8 1 ... ... ... ... 14.97 12.92 11.17 ... ... ... ... 9.84 9.27 9.01 GJ1183 2(1) 14 27 56.1 −00 22 31 0.340 281.4 1 .06170 .00320 1 63 15.32 12.93 11.22 13.95 12.65 10.93 /67 9.31 8.70 8.40 GJ0550.3 1 14 29 18.6 −46 27 50 0.199 195.9 1 .04249 .00207 2 63,64 11.20 8.76 8.06 10.35 9.49 8.61 /5 7.64 7.01c 6.79

– 51 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LP913-027 1 14 29 49.2 −29 32 14 0.249 246.7 1 ... ... ... ... 13.27 11.12 9.67 ... ... ... ... 8.94 8.34c 8.10 GJ0553 1 14 30 47.7 −08 38 47 1.292 259.3 28 .05946 .00140 2 63,64 10.03 7.58 6.98 9.38 8.51 7.67 /5 6.62 6.01 5.77 GJ0552.1 1 14 30 58.9 −54 06 05 0.308 217.1 1 ... ... ... ... 12.80 10.78 9.68 11.66 10.63 9.36 /5 8.60 7.43 7.27 GJ0553.1 1 14 31 01.2 −12 17 46 0.580 234.6 1 .09178 .00370 2 63,64 12.58 9.89 8.66 11.95 10.79 9.30 /5 7.80 7.26 6.96 LP740-020 1 14 31 15.6 −13 18 25 0.345 232.1 1 ... ... ... ... 17.52 15.14 12.52 ... ... ... ... 11.10 10.47 10.10 LHS0375 1 14 31 38.3 −25 25 33 1.386 268.6 36 .04170 .00100 1 63 16.79 14.83 13.07 15.64 14.56 13.35 2/ 12.15 11.67 11.51 SIP1432-3326 2 14 32 04.8 −33 26 26 0.188 119.4 1 ... ... ... ... 16.47J 14.33J 12.12J ... ... ... ... 10.37J 9.85J 9.53J LP913-077 1 14 32 18.0 −33 20 59 0.197 119.1 1 ... ... ... ... 15.25 13.13 11.08 ... ... ... ... 9.69 9.11 8.81 LP857-051 1 14 33 12.2 −22 12 31 0.384 151.8 1 ... ... ... ... 14.56 12.31 10.71 ... ... ... ... 9.68 9.05 8.80 LHS5273 1 14 34 04.9 −18 24 11 0.512 248.5 1 ... ... ... ... 15.39 13.05 10.67 ... ... ... ... 9.58 9.03 8.71 GJ0555 1 14 34 16.8 −12 31 10 0.691 330.3 29 .16078 .00198 3 29,63,64 12.43 10.16 8.23 11.34 10.06 8.44 3/29u 6.84 6.26 5.94 LP913-046 1 14 36 18.1 −30 57 33 0.311 212.2 1 ... ... ... ... 14.22 12.08 10.48 ... ... ... ... 9.54 8.93 8.69 LP620-047 1 14 38 39.4 −02 57 24 0.213 260.7 1 ... ... ... ... 15.01 12.88 11.05 ... ... ... ... 9.86 9.30 9.03 L333-199 1 14 40 20.8 −48 36 59 0.394 137.2 1 ... ... ... ... 12.88 10.55 9.38 ... ... ... ... 8.33 7.71 7.47 LP914-006 1 14 40 22.1 −27 52 42 0.267 213.0 1 ... ... ... ... 14.72 12.55 10.66 13.58 12.44 10.97 /44 9.57 9.03 8.75 LTT05828 1 14 41 09.9 −08 59 20 0.267 281.6 1 ... ... ... ... 14.72 12.60 10.75 ... ... ... ... 9.35 8.76 8.51 SCR1441-7338 1 14 41 14.4 −73 38 41 0.206 029.1 1 ... ... ... ... 18.28 16.15 13.05 17.05 15.31 13.25 /71 11.20 10.61 10.27 LP680-049 1 14 41 15.3 −06 59 09 0.194 104.1 1 ... ... ... ... 14.48 12.44 10.84 ... ... ... ... 9.48 8.94 8.68 LTT05831 3 14 41 35.8 −09 46 39 0.210 263.0 1 ... ... ... ... 13.53J 11.44J 10.02J ... ... ... ... 8.67J 8.05J 7.82J SCR1444-3426 1 14 44 06.6 −34 26 47 0.451 187.7 1 ... ... ... ... 15.01 12.49 10.47 14.17 12.89 11.26 /71 9.74 9.18 8.88 LP858-020 1 14 44 15.0 −27 17 26 0.258 257.5 1 ... ... ... ... 17.08 14.95 12.64 ... ... ... ... 10.89 10.32 10.04 SSS1444-2019 1 14 44 20.3 −20 19 26 3.507 236.0 52 .06160 .00196 2 19,52 21.16 18.47 14.95 20.25 17.62 14.95 3/ 12.55 12.14 11.93 GJ1185 1 14 47 55.2 −03 09 36 0.639 306.0 1 .05080 .00360 1 63 14.39 12.28 10.70 13.33 12.28 10.99 /69 9.78 9.28 9.06 GJ0563.2 2(1) 14 49 33.2 −26 06 20 1.396 275.6 28 .05091a b .0784 3 63,64,64 13.13 11.04 10.13 11.68 10.70 9.62 /5 8.44 7.86 7.64 SIP1452-3458 1 14 52 52.9 −34 58 47 0.392 203.3 1 ... ... ... ... 17.72 15.21 12.26 ... ... ... ... 11.05 10.48 10.16 LP801-025 1 14 54 10.4 −20 41 29 0.300 199.1 1 ... ... ... ... 16.34 14.04 11.43 ... ... ... ... 10.26 9.67 9.35 LTT05930 1 14 54 58.3 −11 23 21 0.433 170.6 1 ... ... ... ... 13.85 11.87 10.02 ... ... ... ... 9.07 8.37 8.18 SCR1456-7239 1 14 56 02.3 −72 39 41 0.207 225.0 1 ... ... ... ... 16.50 14.22 11.99 15.36 13.99 12.28 /71 10.62 10.06 9.74 LP406-203 1 14 56 37.7 −44 56 28 0.241 237.3 1 ... ... ... ... 14.12 11.82 9.72 ... ... ... ... 9.38 8.74 8.49 LHS3003 1 14 56 38.3 −28 09 49 0.975 209.8 10 .15249 .00202 3 10,62,63 18.37 16.07 11.99 16.95 14.90 12.50 /16 9.97 9.32 8.93 LP681-091 1 14 57 33.3 −06 19 49 0.234 164.9 1 .04081 .00460 1 64 11.83 10.12 8.73 11.47 10.59 9.73 /68 8.65 8.00 7.84 SCR1459-4210 1 14 59 57.4 −42 10 09 0.192 200.1 1 ... ... ... ... 16.34 14.54 12.31 15.39 14.07 12.37 1/ 10.68 10.12 9.87 L072-010 1 15 02 07.7 −71 18 01 0.337 225.1 1 ... ... ... ... 13.82 12.04 9.75 13.11 11.91 10.34 2/ 8.84 8.20 7.96 LP914-041 1 15 03 13.2 −28 40 14 0.241 206.7 1 ... ... ... ... 18.52 16.25 13.38 ... ... ... ... 11.51 10.98 10.64 L406-116 1 15 03 42.2 −42 38 51 0.353 222.5 1 ... ... ... ... 13.55 11.39 9.66 ... ... ... ... 9.14 8.47 8.23 LP859-001 1 15 04 16.2 −23 55 57 0.342 254.1 1 ... ... ... ... 20.26 17.92 14.65 ... ... ... ... 12.01 11.38 11.03 LP859-011 1 15 08 23.4 −23 51 38 0.336 225.5 1 ... ... ... ... 12.76 10.52 9.14 11.90 10.89 9.69 /44 8.49 7.88 7.63 TVLM868-110639 1 15 10 16.8 −02 41 08 0.383 277.0 1 .06120 .00470 1 61 21.72 18.81 15.58 20.51 18.04 15.66 /11 12.61 11.84 11.35 LTT06043 1 15 10 35.7 −42 58 37 0.421 229.3 1 .04104 .00228 2 63,64 11.25 9.42 7.86 ... ... ... ... 7.96 7.29 7.15 SCR1511-3403 1 15 11 38.6 −34 03 17 0.553 199.8 1 ... ... ... ... 16.04 14.05 12.09 14.45 13.22 11.60 /71 10.05 9.42 9.13 LHS0392 1 15 11 50.6 −10 14 18 1.005 257.6 36 .06740 .00310 1 63 15.02 12.77 10.63 14.26 12.95 11.28 /69 9.65 9.13 8.87 LP682-018 1 15 15 43.7 −07 25 21 0.329 219.6 1 ... ... ... ... 13.70 11.55 9.41 12.90 11.66 10.07 1/ 8.57 8.02 7.71 LEHPM2-0027 1 15 16 53.1 −28 32 16 0.896 248.3 1 ... ... ... ... 16.37 14.37 12.03 ... ... ... ... 10.52 9.91 9.61 LTT06063 1 15 17 21.7 −80 28 23 0.428 257.8 1 ... ... ... ... 13.81 12.03 10.40 ... ... ... ... 9.09 8.47 8.20 LHS3056 1 15 19 11.7 −12 45 07 0.724 253.5 36 ... ... ... ... 13.65 11.72 9.64 12.87 11.63 10.04 2/ 8.51 7.86 7.58 GJ0581 1 15 19 26.8 −07 43 20 1.224 265.6 65 .16012 .00133 3 63,64,65 11.76 9.53 7.78 10.56 9.44 8.03 3/29u 6.71 6.10 5.84 LTT06128 1 15 21 34.3 −02 16 58 0.298 171.1 1 ... ... ... ... 11.78 9.97 8.46 ... ... ... ... 8.15 7.52 7.26 GJ2112 2 15 22 13.0 −27 49 43 0.764 042.6 1 ... ... ... ... 14.11J 12.23J 10.30J ... ... ... ... 9.09J 8.56J 8.27J G151-064 1 15 29 01.4 −06 12 46 0.354 226.8 1 ... ... ... ... 14.55 12.46 10.39 ... ... ... ... 9.67 9.10 8.78

– 52 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LP802-069 1 15 29 07.2 −17 22 55 0.184 272.3 1 .04017 .00254 1 64 11.08 9.04 7.98 ... ... ... ... 7.64 6.97 6.80 L480-094 1 15 29 40.7 −38 32 28 0.278 216.5 1 ... ... ... ... 15.91 13.83 11.95 ... ... ... ... 10.18 9.66 9.38 L108-087 1 15 30 52.0 −68 01 18 0.213 091.4 1 ... ... ... ... 14.76 12.39 10.01 13.52 12.28 10.63 2/ 9.08 8.50 8.23 LHS3079 1 15 31 38.3 −26 54 07 0.575 219.8 36 ... ... ... ... 14.52 13.17 11.31 13.64 12.51 11.03 1/ 9.62 8.98 8.75 LP915-041 1 15 31 39.9 −29 16 29 0.480 197.3 1 ... ... ... ... 12.32 10.47 9.55 11.36 10.43 9.45 /44 8.40 7.73 7.54 GJ0588 1 15 32 13.0 −41 16 32 1.563 228.7 28 .16852 .00127 2 63,64 11.06 9.20 6.99 9.31 8.25 6.93 /5 5.65 5.03 4.76 LEHPM2-0455 1 15 32 18.9 −25 51 03 0.359 165.3 1 ... ... ... ... 14.70 12.98 11.45 ... ... ... ... 9.79 9.25 9.01 2MA1534-1418 1 15 34 56.9 −14 18 49 1.000 251.0 53 ... ... ... ... 20.29 17.79 14.20 19.15 16.71 14.16 3/ 11.38 10.73 10.31 GJ0590 1 15 36 34.5 −37 54 23 0.898 198.9 1 ... ... ... ... 14.25 12.34 10.41 12.79 11.55 9.93 2/ 8.44 7.90 7.67 GJ0592 1 15 36 58.6 −14 08 02 0.756 214.7 1 .07490 .00380 1 63 13.28 10.87 8.84 12.70 11.49 9.93 /5 8.43 7.87 7.57 LP623-020 1 15 38 14.1 −01 54 55 0.262 217.4 1 ... ... ... ... 15.21 13.19 11.21 ... ... ... ... 9.79 9.21 8.91 SIP1540-2613 1 15 40 29.6 −26 13 43 1.653 226.0 1 ... ... ... ... 20.11 17.93 14.60 19.21 16.57 14.11 1/ 11.65 11.15 10.73 GJ0595 1 15 42 06.5 −19 28 18 2.283 242.9 28 .09942 .00346 2 63,64 13.04 10.95 9.12 11.84 10.73 9.29 3/ 7.92 7.42 7.17 GJ2116 1 15 43 18.3 −20 15 33 1.173 195.3 1 .04673 .00117 1 30 14.31 12.32 10.78 13.06 12.07 10.93 /30 9.78 9.23 9.02 LHS3109 1 15 43 19.6 −30 55 51 0.503 220.1 1 ... ... ... ... 13.98 12.19 10.53 13.15 12.08 10.71 /44 9.39 8.80 8.57 L408-123 2 15 45 41.6 −43 30 29 0.467 215.1 1 ... ... ... ... 14.34J 11.72J 9.74J 13.06J 11.90J 10.40J 3/ 8.94J 8.34J 8.08J LHS3112 1 15 45 54.5 −04 48 23 0.593 241.5 1 ... ... ... ... 17.93 16.07 13.52 ... ... ... ... 11.34 10.75 10.43 LHS3114 1 15 46 31.9 −47 14 01 0.573 224.2 28 .04114 .00316 2 63,64 10.30 8.68 7.81 ... ... ... ... 7.92 7.26 7.09 SCR1546-5534 1 15 46 41.8 −55 34 47 0.436 225.1 1 ... ... ... ... 18.99 17.22 14.03 17.58 15.40 12.98 3/ 10.21 9.55 9.11 LHS3117 2 15 47 24.6 −10 53 47 0.521 225.7 1 .06621 .00318 1 64 12.59J 10.56J 9.19J 11.28J 10.21J 8.91J /34 7.58J 7.04J 6.74J LP803-037 1 15 50 09.8 −20 29 11 0.368 208.4 1 ... ... ... ... 16.82 14.82 12.73 ... ... ... ... 10.90 10.31 10.00 SCR1551-3554 1 15 51 12.2 −35 54 48 0.192 205.1 1 ... ... ... ... 15.94 14.26 12.39 14.48 13.24 11.66 1/ 10.12 9.49 9.19 LHS5303 1 15 52 44.6 −26 23 14 0.525 152.9 1 .09463 .00070 1 16 17.59 15.48 12.31 16.53 14.66 12.49 /16 10.26 9.68 9.32 LP860-046 1 15 53 57.1 −23 11 53 0.314 203.3 1 ... ... ... ... 18.25 16.19 13.59 ... ... ... ... 11.55 10.95 10.62 LP409-071 1 15 54 00.8 −43 03 10 0.235 200.6 1 ... ... ... ... 12.42 9.76 9.15 ... ... ... ... 8.75 8.05 7.86 LP683-049 1 15 54 50.4 −05 21 47 0.203 138.3 1 ... ... ... ... 16.05 14.02 11.83 ... ... ... ... 10.33 9.71 9.38 LTT06368 1 15 58 27.8 −06 51 45 0.256 215.2 1 ... ... ... ... 12.96 10.62 9.17 ... ... ... ... 8.68 8.12 7.81 GJ0606 1 15 59 53.4 −08 15 11 0.230 098.1 1 .07258 .00186 2 63,64 11.01 8.81 7.51 10.49 9.51 8.39 /5 7.19 6.60 6.34 SCR1601-3421 1 16 01 55.7 −34 21 57 0.683 118.3 1 ... ... ... ... 17.05 15.75 13.28 16.18 14.71 12.86 /71 10.96 10.33 9.98 LHS3149 1 16 04 20.0 −06 16 46 0.884 185.8 1 ... ... ... ... 16.50 14.41 11.68 ... ... ... ... 10.45 9.88 9.55 LP917-019 2(1) 16 04 23.2 −33 03 40 0.256 261.3 1 .04367 .00214 1 64 11.32 9.03 8.89 10.08 9.22 8.41 /34 7.38 6.75 6.56 2MA1607-0442 1 16 07 31.2 −04 42 10 0.462 176.5 1 .06390 .00147 1 16 20.98 18.24 14.87 19.49 17.19 14.78 /16 11.90 11.19 10.72 GJ1198 1 16 08 15.0 −10 26 14 1.354 195.1 36 .04710 .00270 1 63 15.57 13.72 11.38 14.69 13.43 11.78 1/ 10.26 9.75 9.53 SCR1608-2913 2 16 08 45.5 −29 13 06 0.540 231.0 1 ... ... ... ... 13.61J 11.65J 9.91J 13.66J 12.49J 11.02J 1/ 9.68Jc 9.15Jc 8.51 LP481-066 1 16 09 13.0 −38 04 33 0.428 227.0 38 ... ... ... ... 14.51 12.96 11.84 ... ... ... ... 9.45 8.81 8.52 SCR1609-3431 1 16 09 46.2 −34 31 07 0.249 198.5 1 ... ... ... ... 18.48 16.61 13.99 17.20 15.59 13.56 1/ 11.58 10.99 10.67 LP684-033 1 16 10 58.4 −06 31 33 0.228 196.5 1 ... ... ... ... 18.33 16.13 12.95 ... ... ... ... 11.35 10.75 10.37 LHS3165 1 16 12 07.1 −40 48 45 0.532 212.0 1 ... ... ... ... 13.81 12.07 11.17 ... ... ... ... 9.22 8.60 8.38 LP804-027 1 16 12 41.8 −18 52 32 0.236 172.1 1 .06946 .00312 1 64 12.13 10.77 8.87 11.37 10.29 8.92 /34 7.56 6.86 6.59 LHS3167 1 16 13 05.9 −70 09 08 0.607 202.1 47 .06025 .00095 1 47 14.58 12.44 10.10 13.71 12.45 10.82 /47 9.26 8.74c 8.39 LHS3169 1 16 14 21.9 −28 30 37 0.521 228.9 1 .05343 .00146 1 47 14.01 12.01 10.30 12.95 11.80 10.29 /47 8.92 8.36 8.11 GJ0618 2 16 20 03.5 −37 31 45 1.269 323.3 1 .12053 .00244 2 63,64 11.51J 10.05J 9.71J 10.62 9.46 8.11 1/ 6.79 6.22 5.95 LP917-025 1 16 20 37.6 −30 39 41 0.213 356.4 1 ... ... ... ... 12.89 10.88 9.80 11.96 10.98 9.81 /46 8.61 8.01 7.80 LP805-001 1 16 20 41.9 −20 05 14 0.180 229.8 1 ... ... ... ... 15.02 13.56 12.04 13.68 12.44 10.84 1/ 9.36 8.75 8.42 LP625-004 2(1) 16 21 26.3 −01 47 02 0.328 193.9 1 ... ... ... ... 14.56 12.54 10.87 ... ... ... ... 9.71 9.10 8.89 GJ0618.4 1 16 22 41.0 −48 39 20 0.729 230.7 1 .04214 .00335 2 63,64 12.89 10.94 9.18 11.84 10.85 9.70 /5 8.48 7.87 7.64 LEP1623-6905 1 16 23 02.8 −69 05 37 1.594 219.1 35 ... ... ... ... 17.72 14.82 12.70 16.78 15.14 13.13 2/ 11.38 10.86 10.54 GJ0620 1 16 23 07.6 −24 42 35 0.760 207.1 28 .06066 .00205 2 63,64 11.47 10.62 9.90 10.22 9.30 8.34 /5 7.26 6.59 6.39 LTT06556 1 16 25 01.5 −12 15 26 0.270 223.8 1 ... ... ... ... 13.48 11.61 9.94 12.87 11.82 10.50 /44 9.19 8.51 8.30

– 53 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

GJ0622 1 16 25 13.0 −21 56 14 0.664 239.2 28 .05536 .00225 2 63,64 11.73 9.80 9.15 10.41 9.50 8.63 /5 7.55 6.92 6.73 LHS3197 1 16 26 48.1 −17 23 34 0.511 217.5 1 .05503 .00136 1 47 14.91 12.74 10.22 14.30 12.93 11.16 /47 9.55 9.00 8.68 SCR1626-3812 1 16 26 51.7 −38 12 33 0.397 229.8 1 ... ... ... ... 17.46 15.82 13.15 15.75 14.23 12.29 2/ 10.37 9.80 9.44 GJ2120 1 16 27 33.2 −10 00 29 0.397 214.5 1 .04372 .00313 1 64 11.30 9.11 8.40 10.85 9.89 8.84 /34 7.69 7.04 6.83 GJ2121 1 16 30 13.1 −14 39 50 0.540 247.6 1 .04458 .00536 1 64 12.37 10.60 9.02 12.35 11.25 9.83 /69 8.42 7.92 7.60 GJ0628 1 16 30 18.1 −12 39 45 1.188 184.3 28 .23438 .00150 2 63,64 10.07 8.04 5.99 10.07 8.89 7.37 3/ 5.95 5.37 5.08 SCR1630-3633 2 16 30 27.2 −36 33 56 0.369 262.2 1 ... ... ... ... 15.94J 14.39J 11.88J 14.95J 13.47J 11.59J /71 10.04J 9.50J 9.03J 2MA1632-0631 1 16 32 58.8 −06 31 48 0.367 175.4 1 .05331 .00148 1 16 21.71 19.50 15.88 20.23 18.01 15.58 /16 12.74 12.05 11.62 L339-020 1 16 34 43.8 −46 01 31 0.261 173.8 1 ... ... ... ... 12.05 10.08 9.20 ... ... ... ... 8.38 7.69 7.51 L483-080 1 16 34 59.0 −38 34 34 0.377 200.8 1 ... ... ... ... 14.22 12.55 11.45 ... ... ... ... 9.37 8.70 8.46 LHS3218 1 16 35 24.6 −27 18 55 0.889 180.7 47 .05388 .00077 1 47 15.64 13.79 11.79 14.18 12.93 11.28 /47 9.78 9.27 9.00 UPM1635-5202 1 16 35 37.2 −52 02 01 0.203 299.6 1 ... ... ... ... 16.73 14.73 12.22 15.58 14.09 12.18 1/ 10.41 9.80 9.56 LHS0423 1 16 35 40.4 −30 51 20 1.158 223.6 29 .05139 .00294 1 29 13.14 11.35 10.00 12.66 11.58 10.16 2/29u 8.89 8.36 8.08 LP685-036 1 16 36 06.0 −04 40 13 0.390 255.3 1 ... ... ... ... 17.27 15.27 12.96 ... ... ... ... 11.05 10.51 10.18 SCR1636-4041 1 16 36 57.6 −40 41 09 0.284 192.6 1 ... ... ... ... 14.69 12.89 10.93 13.47 12.26 10.70 1/ 9.20 8.57 8.31 L555-115 1 16 36 58.4 −33 46 51 0.324 132.8 1 ... ... ... ... 13.96 12.09 10.49 ... ... ... ... 9.12 8.48c 8.25 SCR1639-4652 1 16 39 25.8 −46 53 00 0.301 195.5 1 ... ... ... ... 14.46 12.44 10.46 13.28 12.12 10.67 1/ 9.30 8.69 8.43 GJ0633 1 16 40 45.3 −45 59 59 0.520 139.6 1 .05980 .00119 2 47,63 13.90 11.28 9.85 12.67 11.56 10.20 /47 8.89 8.31 8.05 GJ0634 1 16 41 28.3 −43 59 11 0.591 215.1 1 .05740 .00660 1 63 12.56 10.28 9.08 11.58 10.57 9.38 /5 8.14 7.62 7.33 LP686-002 1 16 43 55.9 −07 26 10 0.226 220.4 1 ... ... ... ... 12.05 9.97 9.40 ... ... ... ... 8.54 7.98c 7.71 2MA1643-7530 1 16 43 57.7 −75 30 21 0.183 213.3 1 ... ... ... ... 12.14 10.54 9.54 ... ... ... ... 8.43 7.81 7.57 2MA1645-1319 1 16 45 22.1 −13 19 52 0.895 203.5 1 ... ... ... ... ... 18.80 15.97 20.30 17.95 15.67 2/ 12.45 11.69 11.15 LP806-004 2(1) 16 47 35.6 −19 44 27 0.205 251.8 1 ... ... ... ... 12.92 10.97 9.65 12.04 11.04 9.87 /44 8.64 8.04c 7.79 LP154-205 1 16 47 55.2 −65 09 12 0.330 115.0 38 ... ... ... ... 15.11 12.73 10.70 13.98 12.73 11.16 2/ 9.70 9.17 8.88 GJ0637 1 16 48 24.5 −72 58 34 0.709 219.5 1 .06305 .00195 2 63,64 12.20 10.33 9.49 11.35 10.37 9.26 /5 8.04 7.48 7.22 LP806-008 1 16 48 46.0 −15 44 20 0.212 176.1 1 .05486 .00218 1 64 11.66 10.30 8.55 10.94 9.97 8.84 /66 7.66 7.00 6.77 LHS3246 1 16 50 53.8 −04 50 35 0.763 249.2 1 ... ... ... ... 14.22 12.20 10.43 13.45 12.30 10.81 /69 9.47 8.92c 8.68 GJ0644 5(3) 16 55 28.8 −08 20 11 1.206 222.2 28 .15496a .00052 5 10,58,6,63,64 9.61J 8.51J 5.49J 9.03J 7.94J 6.57J /5 5.27J 4.78J 4.40J LTT06745 1 16 55 38.0 −32 04 04 0.360 165.9 1 .05478 .00116 1 64 10.94 9.10 8.52 9.57 8.70 7.90 /34 6.92 6.25 6.05 SCR1656-2046 1 16 56 33.6 −20 46 37 0.275 224.0 1 ... ... ... ... 18.65 16.39 13.66 17.36 15.58 13.42 1/ 11.30 10.71 10.37 GJ0645 1 16 56 45.1 −37 03 39 0.469 198.0 38 .05830 .00900 1 63 12.94 11.53 10.73 11.44 10.46 9.34 /5 8.17 7.57 7.34 SCR1656-4238 1 16 56 49.8 −42 38 48 0.220 191.9 1 ... ... ... ... 14.42 11.96 10.32 13.33 12.23 10.82 1/ 9.52 8.86 8.61 GJ1207 1 16 57 05.7 −04 20 56 0.612 129.0 1 .11526 .00150 2 25,63 13.66 10.08 9.70 12.25 11.00 9.43 /49 7.97 7.44c 7.12 SCR1659-6958 1 16 59 28.1 −69 58 18 0.721 207.0 1 ... ... ... ... 15.93 14.30 11.63 15.36 13.93 12.15 3/ 10.54 10.00 9.70 LP746-041 1 17 00 42.2 −09 25 35 0.371 221.0 1 ... ... ... ... 16.61 15.46 12.15 ... ... ... ... 10.79 10.20 9.87 LEHPM2-1755 1 17 06 50.0 −82 11 42 0.290 214.9 1 ... ... ... ... 15.47 13.30 11.34 ... ... ... ... 10.13 9.56 9.28 BD-06 04552 1 17 07 34.8 −06 27 26 0.282 173.4 1 ... ... ... ... 14.22 12.71 11.28 ... ... ... ... 9.57 8.90 8.71 NLTT44215 1 17 08 23.8 −18 27 58 0.278 250.2 1 ... ... ... ... 15.07 12.88 12.35 ... ... ... ... 9.88 9.24 9.16 UPM1710-5300 2 17 10 44.3 −53 00 25 0.207 184.3 1 ... ... ... ... 12.47J 10.03J 7.99J 11.73J 10.63J 9.29J 1/ 8.00J 7.41J 7.16J L268-067 1 17 10 59.2 −52 30 56 0.280 304.9 28 .08017 .00184 1 64 10.38 8.15 6.51 10.02 9.06 8.00 /34 6.87 6.23 6.03 GJ0660 2 17 11 52.3 −01 51 06 0.549 235.0 63 .08523 .00247 2 58,63 11.86J 10.42J 8.37J 11.37J 10.25J 8.82J /5 7.46J 6.92J 6.66J LP919-015 1 17 12 01.2 −27 46 02 0.240 242.8 1 ... ... ... ... 15.15 13.52 12.30 13.40 12.29 10.85 1/ 9.51 8.91 8.66 SIP1712-0323 1 17 12 04.3 −03 23 30 0.434 242.6 1 ... ... ... ... 19.10 17.29 14.48 18.02 16.21 13.99 1/ 11.61 10.99 10.64 GJ0660.1 2 17 12 51.3 −05 07 32 0.717 163.5 1 .04999 .00339 2 63,64 12.58J 10.44J 9.87J 11.61J 10.70J 9.75J /5 8.66 8.07 7.94 LP413-057 1 17 13 09.6 −41 28 28 0.325 186.8 1 ... ... ... ... 13.60 11.48 10.32 ... ... ... ... 9.03 8.43c 8.17 GJ1212 2 17 13 40.5 −08 25 15 0.591 227.0 1 .05468 .00443 2 63,64 13.07J 10.69J 9.65J 12.03J 10.93J 9.53J /34 8.12J 7.51J 7.25J LTT06876 1 17 15 54.9 −02 50 10 0.303 165.0 37 ... ... ... ... 12.49 10.59 10.25 ... ... ... ... 8.79 8.13 7.97 LP687-017 1 17 16 20.7 −05 23 51 0.233 127.6 1 ... ... ... ... 13.70 12.28 10.76 12.49 11.39 10.02 1/ 8.70 8.09 7.83 L845-016 2(1) 17 17 45.3 −11 48 54 0.298 180.9 1 ... ... ... ... 14.14 12.53 10.23 12.92 11.81 10.38 /67 8.82 8.11 7.83

– 54 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LP687-045 1 17 18 29.1 −07 39 15 0.313 239.7 1 ... ... ... ... 15.13 13.56 12.13 ... ... ... ... 9.89 9.37 9.05 OUT1720-1725 1 17 20 52.4 −17 25 40 0.358 250.0 1 ... ... ... ... 14.69 13.33 11.63 14.20 12.97 11.38 1/ 9.79 9.19 8.92 GJ0672.1 1 17 23 49.2 −32 15 16 0.596 198.0 63 .04238 .00392 2 63,64 13.43 11.12 9.92 11.64 10.67 9.55 /5 8.38 7.82 7.52 L989-038 1 17 24 16.9 −04 21 52 0.262 239.1 1 ... ... ... ... 13.30 11.86 10.80 12.13 11.08 9.77 2/ 8.52 7.91 7.66 SCR1726-8433 1 17 26 22.9 −84 33 08 0.513 134.9 1 ... ... ... ... 15.42 13.31 11.16 14.25 13.00 11.41 /71 9.87 9.33 9.02 GJ1218 1 17 28 07.3 −62 27 14 0.959 197.4 29 .06132 .00110 2 10.29 13.97 11.93 9.84 12.74 11.54 9.96 3/29u 8.42 7.85c 7.57 SCR1728-0143 1 17 28 11.1 −01 43 57 0.206 148.7 1 ... ... ... ... 15.61 13.93 11.99 14.42 13.15 11.51 2/ 9.89 9.32 9.01 GJ0674 1 17 28 39.9 −46 53 43 1.060 153.8 1 .22011 .00139 2 63,64 9.43 7.02 4.90 9.37 8.28 6.97 2/ 5.71 5.15 4.86 LHS3295 1 17 29 27.3 −80 08 57 0.670 317.9 1 .07995 .00182 1 47 13.49 11.39 9.64 12.18 11.02 9.53 /47 8.09 7.52 7.30 GJ0676 2(1) 17 30 11.2 −51 38 13 0.321 228.4 1 .06132 .00160 2 63,64 10.96 9.26 8.63 9.59 8.68 7.76 /34 6.71 6.08 5.83 SCR1731-2452 1 17 31 03.8 −24 52 44 0.198 217.6 1 ... ... ... ... 14.76 13.40 13.00 13.23 12.08 10.64 1/ 9.27 8.61 8.38 LP920-019 1 17 31 20.9 −27 39 20 0.190 204.2 1 ... ... ... ... 13.18 11.91 11.95 ... ... ... ... 9.08 8.45 8.30 SIP1731-7851 1 17 31 44.9 −78 51 26 0.362 189.2 1 ... ... ... ... 18.83 16.78 14.17 ... ... ... ... 11.61 11.01 10.68 UPM1732-4736 1 17 32 21.9 −47 36 58 0.253 235.8 1 ... ... ... ... 14.88 12.77 11.00 13.98 12.72 11.12 1/ 9.59 8.98 8.68 LP688-003 1 17 34 08.7 −08 49 52 0.355 207.3 1 ... ... ... ... 17.13 15.43 13.24 ... ... ... ... 10.91 10.40 10.06 HD320012 1 17 34 15.4 −35 19 54 0.204 217.7 1 ... ... ... ... 16.63 15.28 14.42 ... ... ... ... 11.76 10.45c 9.83c GJ0680 1 17 35 13.6 −48 40 51 0.456 006.2 28 .10215 .00270 2 63,64 11.32 9.36 7.95 10.17 9.13 7.89 /5 6.67 6.08 5.83 L112-088 1 17 36 14.6 −67 56 06 0.268 183.1 1 ... ... ... ... 15.38 13.26 11.17 ... ... ... ... 10.04 9.45 9.17 GJ0682 1 17 37 03.7 −44 19 09 1.177 217.1 28 .19809 .00206 2 63,64 11.19 8.99 7.47 10.99 9.75 8.15 2/ 6.54 5.92 5.61 LP920-069 2(1) 17 38 03.6 −30 00 57 0.199 203.2 1 ... ... ... ... 12.44 10.18 9.33 ... ... ... ... 8.12 7.46 7.27 L204-148 1 17 38 32.5 −58 32 34 0.305 169.2 1 ... ... ... ... 13.69 11.32 9.15 12.52 11.38 9.91 2/ 8.48 7.93 7.67 SCR1738-5942 1 17 38 41.0 −59 42 24 0.280 148.3 1 ... ... ... ... 16.57 14.21 11.93 14.95 13.65 11.96 /71 10.38 9.83 9.58 LHS3315 1 17 42 10.8 −08 49 00 0.972 237.9 1 .04290 .00320 1 63 14.72 13.41 12.02 ... ... ... ... 9.81 9.32 9.07 GJ0690.1 1 17 42 32.3 −16 38 25 0.656 191.4 36 .05150 .00520 1 63 14.02 14.25 10.81 13.00 11.96 10.68 /5 9.44 8.93 8.68 LP921-012 1 17 44 17.4 −29 15 48 0.224 197.8 1 ... ... ... ... 13.77 11.96 11.31 ... ... ... ... 9.86 9.12 8.63 LTT07069 1 17 45 07.4 −08 00 45 0.338 217.0 37 ... ... ... ... 12.45 10.79 9.73 ... ... ... ... 8.57 7.92 7.76 L270-064 1 17 45 43.7 −52 47 38 0.194 101.2 1 ... ... ... ... 14.66 12.48 10.69 ... ... ... ... 9.71 9.12 8.89 GJ2130 3(1) 17 46 12.8 −32 06 09 0.278 196.2 25 .07060a .00159 3 18,25,2 ... .. ... 10.50 9.49 8.34 /25 7.11 6.53 6.25 G154-016 1 17 46 23.3 −18 07 09 0.281 198.9 1 ... ... ... ... 15.44 13.66 12.53 ... ... ... ... 9.94 9.27 9.02 LTT07077 1 17 46 29.4 −08 42 37 0.453 183.4 1 ... ... ... ... 13.68 12.18 9.92 12.72 11.44 9.78 2/ 8.20 7.69 7.35 GJ0693 1 17 46 34.2 −57 19 09 1.711 218.0 1 .17110 .00222 2 63,64 11.70 9.43 8.37 10.77 9.62 8.20 2/ 6.86 6.30 6.02 SCR1746-3214 1 17 46 40.7 −32 14 04 0.240 062.2 1 ... ... ... ... 17.94 15.89 12.71 16.15 14.47 12.40 2/ 10.35 9.74 9.38 G020-014 1 17 47 10.2 −01 29 55 0.318 189.6 1 ... ... ... ... 14.83 12.93 11.18 ... ... ... ... 9.62 9.03 8.76 L415-082 1 17 57 14.2 −41 59 29 0.353 188.5 1 ... ... ... ... 11.24 8.96 7.89 11.28 10.30 9.17 3/ 7.96 7.37 7.14 L271-081 1 17 57 22.6 −52 29 07 0.273 149.1 1 ... ... ... ... 14.55 12.10 10.62 ... ... ... ... 9.44 8.93c 8.61 LP749-016 1 17 59 58.7 −13 23 44 0.199 147.7 28 ... ... ... ... 13.37 11.82 11.07 ... ... ... ... 9.27 8.64 8.49 G154-043 1 18 03 36.1 −18 58 51 0.395 141.8 1 ... ... ... ... 15.98 13.80 11.95 14.13 12.72 10.90 2/ 9.13 8.53 8.28 GJ0701 1 18 05 07.6 −03 01 53 0.662 120.3 28 .12872 .00136 2 63,64 10.68 8.18 9.56 9.37 8.38 7.30 /5 6.16 5.57 5.31 SCR1805-2042 1 18 05 15.1 −20 42 28 0.272 232.3 1 ... ... ... ... 16.84 15.08 12.96 15.21 13.85 12.21 1/ 10.58 9.95 9.62 GJ1224 1 18 07 32.9 −15 57 47 0.702 241.0 49 .12699 .00101 2 49,63 15.41 13.07 10.98 13.48 12.08 10.31 /49 8.64 8.09 7.83 LEP1809-0219 1 18 09 43.7 −02 19 35 0.502 176.9 1 ... ... ... ... 16.63 15.95 12.94 15.10 13.72 11.95 2/ 10.12 9.61 9.27 G154-048 1 18 10 11.0 −15 25 48 0.238 143.5 1 ... ... ... ... 16.10 14.59 12.95 ... ... ... ... 10.49 9.95 9.66 L043-072 2 18 11 15.3 −78 59 23 0.279 020.0 38 ... ... ... ... 13.74J 11.29J 9.64J 12.57J 11.23J 9.50J 2/ 7.84J 7.33J 6.96J LP629-020 1 18 11 23.4 −02 17 50 0.234 339.5 1 ... ... ... ... 15.07 13.75 14.01 ... ... ... ... 10.23 9.72 9.50 LHS3370 1 18 13 52.9 −77 08 21 0.775 195.9 1 .04285 .00425 1 11 16.49 14.40 12.40 15.38 14.11 12.55 /11 11.13 10.62 10.35 LTT07246 1 18 15 12.4 −19 24 07 0.430 168.8 1 ... ... ... ... 11.93 10.15 7.48 10.88 9.88 8.73 2/ 7.32 6.72 6.45 LHS3378 1 18 19 17.0 −77 02 50 0.601 197.9 1 ... ... ... ... 15.11 13.17 11.42 ... ... ... ... 9.81 9.35 9.06 LP690-011 1 18 19 59.6 −06 17 32 0.238 120.0 37 ... ... ... ... 15.11 13.98 12.78 ... ... ... ... 10.15 9.54 9.31 WT0562 1 18 26 19.8 −65 47 41 0.640 177.5 1 .05843 .00090 1 47 16.82 14.49 11.97 15.36 13.93 12.13 /47 10.35 9.81 9.45

– 55 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

SCR1826-6542 1 18 26 46.8 −65 42 40 0.311 179.0 1 ... ... ... ... 18.68 16.44 12.91 17.35 15.28 12.96 /71 10.57 9.96 9.55 GJ0714 1 18 30 12.0 −58 16 28 0.476 176.9 1 ... ... ... ... 10.91 8.30 7.45 9.81 8.89 7.93 2/ 6.87 6.24 5.96 L489-068 1 18 38 30.3 −39 04 31 0.239 075.3 1 ... ... ... ... 14.57 12.17 10.37 ... ... ... ... 9.54 8.96 8.69 GJ2138 2 18 38 44.8 −14 29 26 0.582 168.8 28 .07760 .00279 1 64 12.66J 10.84J 8.87J 11.22J 10.18J 8.93J /34 7.66J 7.06J 6.85J GJ0723 1 18 40 17.8 −10 27 55 0.552 198.0 28 .04612 .00581 2 63,64 12.53 9.50 8.42 11.47 10.46 9.38 /5 8.26 7.69 7.46 Wolf1467 1 18 40 50.2 −08 04 59 0.230 195.0 72 ... ... ... ... 14.78 12.83 11.51 ... ... ... ... 9.56 9.05 8.74 GJ0724 1 18 40 57.3 −13 22 47 0.677 187.9 28 .06056 .00199 2 63,64 12.14 10.21 9.21 10.62 9.63 8.56 /5 7.40 6.73c 6.55 SCR1841-4347 1 18 41 09.8 −43 47 33 0.854 265.4 1 ... ... ... ... 17.65 15.19 12.32 16.46 14.72 12.59 /71 10.48 9.94 9.60 LHS5341 1 18 43 07.0 −54 36 48 0.499 197.0 36 ... ... ... ... 13.89 11.91 9.91 12.97 11.68 10.03 3/ 8.42 7.79 7.49 LTT07419 2(1) 18 43 12.5 −33 22 46 0.394 203.3 11 .06551 .00251 1 11 10.34 8.34 7.32 10.25 9.30 8.28 2/ 7.19 6.54 6.33 SCR1845-6357 2 18 45 05.3 −63 57 48 2.664 076.6 25 .25950 .00111 2 14,25 ... 16.33J 12.53J 17.40J 15.00J 12.46J /71 9.54J 8.97J 8.51J LTT07434 2 18 45 57.5 −28 55 53 0.424 130.7 1 ... ... ... ... 14.84J 13.47J 12.31J 12.68J 11.49J 9.94J 3/ 8.41J 7.90J 7.60J SCR1847-1922 1 18 47 16.7 −19 22 21 0.650 227.6 1 ... ... ... ... 15.36 13.08 10.94 14.35 13.11 11.48 /71 9.91 9.38 9.09 LTT07452 1 18 48 01.3 −14 34 51 0.350 222.8 1 ... ... ... ... 13.55 11.93 10.04 12.08 11.00 9.67 2/ 8.38 7.83 7.56 SCR1848-6855 2 18 48 21.0 −68 55 34 1.281 195.7 31 .04063 .00072 1 31 17.99J 16.07J 13.97J 16.86J 15.68J 13.83J /31 11.89J 11.40J 11.10J LHS3411 1 18 48 38.7 −61 35 26 0.544 196.7 36 ... ... ... ... 13.80 11.79 10.01 ... ... ... ... 9.05 8.45 8.17 L345-091 2 18 48 41.4 −46 47 08 0.243 057.1 1 ... ... ... ... 12.54J 10.82J 9.29J 11.60J 10.50J 9.12J 3/ 7.83J 7.24J 6.99J SIP1848-8214 1 18 48 51.1 −82 14 42 0.274 189.6 1 ... ... ... ... 19.69 17.54 14.37 18.55 16.33 14.00 2/ 11.48 10.92 10.50 LP691-015 1 18 49 06.4 −03 15 18 0.254 090.8 1 ... ... ... ... 15.80 14.40 11.85 14.23 12.91 11.22 2/ 9.61 8.98 8.70 GJ0729 1 18 49 49.4 −23 50 11 0.643 107.8 1 .33722 .00197 2 63,64 11.55 10.70 8.15 10.50 9.26 7.68 3/ 6.22 5.66 5.37 LHS3413 1 18 49 51.2 −57 26 49 0.634 257.0 1 .08221 .00201 1 47 13.75 11.44 9.04 12.68 11.44 9.88 /47 8.32 7.70 7.46 2MA1849-0134 1 18 49 55.4 −01 34 09 0.216 166.6 1 ... ... ... ... 14.29 12.76 11.38 ... ... ... ... 9.78 9.11 8.84 LHS3418 1 18 52 00.2 −60 46 11 0.698 298.9 36 ... ... ... ... 14.47 12.21 10.20 ... ... ... ... 9.31 8.72 8.46 L489-043 1 18 52 25.3 −37 30 36 0.471 102.0 1 ... ... ... ... 13.05 10.95 8.75 12.71 11.49 9.86 2/ 8.38 7.86 7.56 GJ0732 2(1) 18 53 39.9 −38 36 45 1.011 161.1 36 ... ... ... ... 12.90 11.07 9.41 12.66 11.45 9.87 2/ 8.40 7.82 7.59 L077-046 1 18 55 14.7 −71 15 03 0.260 187.3 1 ... ... ... ... 15.76 13.77 11.26 ... ... ... ... 10.08 9.47 9.22 SCR1855-6914 1 18 55 47.9 −69 14 15 0.885 146.1 1 ... ... ... ... 18.01 15.63 12.20 16.61 14.79 12.66 /71 10.47 9.88 9.51 SCR1856-4704 2 18 56 38.4 −47 04 58 0.248 134.4 1 ... ... ... ... 16.29J 13.93J 11.65J 14.85J 13.55J 11.87J /71 10.29J 9.75J 9.45J SCR1856-4011 3(2) 18 57 01.1 −40 11 51 0.219 171.0 1 ... ... ... ... 14.67J 12.98J 10.56J 14.44J 13.07J 11.31J 1/ 9.86 9.74c 9.08 GJ0737 2 18 57 30.6 −55 59 30 0.450 180.4 28 .08084 .00189 2 63,64 10.10J 7.75J 6.51J 8.84J 7.90J 6.92J /34 5.87J 5.25Jc 5.03J GJ0739 1 18 59 07.5 −48 16 28 0.516 163.5 28 .07048 .00240 3 63,63,64 11.92 9.93 8.81 11.14 10.10 8.80 /34 7.52 6.93 6.70 L159-126 1 18 59 40.7 −63 27 22 0.222 031.0 1 ... ... ... ... 13.97 11.83 9.68 ... ... ... ... 8.89 8.42 8.08 SCR1901-0737 1 19 01 32.4 −07 37 24 0.189 227.1 1 ... ... ... ... 16.53 14.44 12.12 15.63 14.19 12.38 1/ 10.57 10.00 9.70 SCR1901-3106 1 19 01 59.2 −31 06 45 0.211 122.4 1 ... ... ... ... 13.97 11.90 10.93 14.19 12.99 11.54 1/ 9.61 9.01 8.77 GJ0741 1 19 03 16.7 −13 34 05 0.780 226.0 63 .05240 .00380 1 63 14.62 14.01 11.43 14.78 13.63 12.08 /5 10.38 9.80 9.54 SCR1904-2406 1 19 04 21.8 −24 06 16 0.213 289.9 1 ... ... ... ... 15.63 13.53 11.59 14.53 13.27 11.64 1/ 10.12 9.55 9.27 L274-159 1 19 05 20.3 −54 34 43 0.228 159.9 1 ... ... ... ... 14.42 12.46 10.73 ... ... ... ... 9.41 8.71 8.55 L490-020 1 19 08 22.1 −37 05 28 0.258 131.8 1 ... ... ... ... 14.75 12.79 10.92 ... ... ... ... 9.76 9.19 8.93 SIP1910-4132 3(1) 19 10 34.6 −41 33 45 0.738 174.7 14 ... ... ... ... 15.17 12.93 11.00 ... ... ... ... 9.85 9.25 9.03 L346-096 1 19 11 04.1 −47 39 14 0.212 165.8 1 ... ... ... ... 15.90 13.77 11.35 ... ... ... ... 10.11 9.51 9.23 GJ0747.4 1 19 12 25.3 −55 52 08 0.302 240.6 1 .04666 .00319 2 63,64 12.21 10.12 9.07 11.30 10.34 9.35 /5 8.22 7.61 7.38 WIS1912-3615 1 19 12 39.3 −36 14 57 2.091 158.1 23 ... ... ... ... 14.44 12.16 10.09 13.91 12.64 11.00 3/ 9.52 9.01c 8.77 SCR1913-2312 1 19 13 06.1 −23 12 05 0.446 157.3 1 ... ... ... ... 17.89 15.81 13.40 17.01 15.43 13.43 1/ 11.43 10.87 10.52 LHS3443 1 19 13 08.0 −39 01 54 0.506 120.1 1 .04857 .00114 1 47 13.30 11.68 9.70 12.39 11.27 9.85 /47 8.47 7.92 7.66 LP868-019 1 19 16 35.6 −25 38 42 0.323 172.1 1 ... ... ... ... 14.75 12.67 10.83 ... ... ... ... 9.70 9.10 8.85 GJ0750 2 19 16 42.9 −45 53 22 0.450 154.0 63 .06450 .00186 2 58,63 10.29J 7.95J 7.13J 9.36J 8.43J 7.48J /34 6.45J 5.77J 5.57J SCR1918-4554 1 19 18 29.5 −45 54 30 0.700 220.4 1 ... ... ... ... 17.89 15.29 12.57 16.58 15.03 13.07 1/ 11.21 10.65 10.30 L160-005 1 19 19 41.2 −59 55 20 0.354 228.1 1 ... ... ... ... 14.90 12.61 10.29 ... ... ... ... 9.45 8.89 8.61 GJ0754 1 19 20 48.0 −45 33 30 2.961 167.5 29 .16917 .00153 2 29,63 13.12 10.96 8.83 12.25 10.94 9.25 3/29u 7.66 7.13 6.85

– 56 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS0475 1 19 20 54.3 −82 33 16 1.269 164.8 1 .08304 .00093 1 30 13.74 11.83 10.14 12.69 11.51 10.00 /30 8.56 8.00 7.69 SCR1922-3503 1 19 22 05.6 −35 03 45 0.258 142.0 1 ... ... ... ... 15.82 13.26 11.28 14.90 13.59 11.91 1/ 10.29 9.78 9.47 SCR1924-0931 1 19 24 11.0 −09 31 34 0.240 165.6 1 ... ... ... ... 14.76 12.72 10.81 13.89 12.73 11.21 1/ 9.83 9.20 8.93 SCR1927-0409 1 19 27 13.0 −04 09 49 0.269 164.6 1 ... ... ... ... 16.47 14.77 12.47 15.38 14.01 12.23 1/ 10.56 9.94 9.68 LHS5348 2 19 27 52.7 −28 11 15 0.509 170.5 1 ... ... ... ... 15.79J 13.55J 11.01J 14.85J 13.36J 11.46J 2/ 9.69J 9.11J 8.79J L045-006 1 19 29 38.3 −74 44 42 0.312 086.1 1 ... ... ... ... 12.91 10.73 9.96 11.80 10.78 9.53 1/ 8.29 7.73 7.45 L078-093 1 19 31 01.4 −73 37 06 0.290 116.0 38 ... ... ... ... 13.52 12.20 10.71 ... ... ... ... 9.18 8.51 8.24 SCR1931-0306 1 19 31 04.6 −03 06 18 0.505 023.4 1 ... ... ... ... 17.67 15.77 12.93 16.81 15.11 13.11 /71 11.15 10.56 10.23 L348-141 1 19 31 53.2 −48 33 54 0.437 169.0 1 ... ... ... ... 16.50 14.34 11.76 ... ... ... ... 10.63 10.02 9.72 SCR1932-5005 1 19 32 48.6 −50 05 39 0.257 157.6 1 ... ... ... ... 16.87 14.51 11.99 15.47 14.14 12.42 /71 10.75 10.11 9.85 L275-026 1 19 34 03.9 −52 25 14 0.273 169.5 1 ... ... ... ... 13.92 11.56 9.38 12.83 11.68 10.19 2/ 8.77 8.16 7.92 LP869-042 1 19 39 36.2 −26 45 07 0.440 132.6 1 .04307 .00192 1 64 11.58 9.64 8.69 10.48 9.56 8.58 /34 7.50 6.83 6.65 LP869-019 1 19 42 00.7 −21 04 06 0.306 164.4 1 ... ... ... ... 14.01 12.08 9.93 13.22 11.93 10.28 3/ 8.69 8.08 7.82 L420-142 1 19 42 53.3 −44 06 28 0.261 130.5 1 ... ... ... ... 14.32 12.14 10.14 ... ... ... ... 9.43 8.85 8.59 2MA1943-3722 1 19 43 24.7 −37 22 11 0.261 135.5 1 ... ... ... ... 14.43 12.28 10.17 ... ... ... ... 9.20 8.49 8.25 LP925-037 1 19 43 51.8 −32 24 04 0.409 179.0 1 ... ... ... ... 12.38 10.53 9.23 11.87 10.87 9.65 1/ 8.12 7.53 7.29 LP869-026 2 19 44 53.8 −23 37 59 0.410 115.8 1 ... ... ... ... 15.24J 13.19J 10.71J 14.09J 12.65J 10.85J 3/ 9.17J 8.57J 8.27J LHS3484 1 19 47 04.5 −71 05 33 0.682 169.9 1 ... ... ... ... 14.86 12.74 10.75 13.88 12.70 11.19 /47 9.79 9.22 8.98 SCR1947-7646 1 19 47 14.7 −76 46 55 0.235 133.8 1 ... ... ... ... 17.58 15.78 13.35 16.80 15.25 13.31 1/ 11.39 10.78 10.49 WT2180 1 19 48 22.7 −08 22 52 0.546 228.3 1 ... ... ... ... 17.91 15.70 12.93 ... ... ... ... 11.12 10.54 10.19 2MA1951-3510 2 19 51 35.9 −35 10 38 0.373 078.4 1 ... ... ... ... 13.97J 11.57J 9.49J 13.06J 11.75J 10.08J 3/ 8.58J 8.04J 7.74J 2MA1951-4025 1 19 51 36.0 −40 25 21 0.204 160.2 1 ... ... ... ... 14.49 12.38 10.27 ... ... ... ... 9.58 8.98 8.71 LP870-054 1 19 52 41.6 −24 46 02 0.344 182.6 1 ... ... ... ... 14.16 12.27 10.86 ... ... ... ... 9.51 8.93 8.69 L160-159 1 19 54 04.1 −64 38 10 0.297 142.7 1 ... ... ... ... 15.21 13.16 11.18 ... ... ... ... 9.96 9.34 9.09 LP926-055 1 19 54 24.9 −31 47 60 0.475 255.0 1 ... ... ... ... 14.28 12.15 10.38 ... ... ... ... 9.10 8.57 8.32 LEHPM2-4639 1 19 56 06.6 −54 42 54 0.193 139.8 1 ... ... ... ... 13.80 11.73 9.37 ... ... ... ... 9.16 8.48 8.34 LP754-008 1 19 57 52.0 −10 53 05 0.462 230.7 1 ... ... ... ... 15.06 13.29 10.98 14.35 13.06 11.38 /45 9.73 9.17 8.84 SCR1959-3631 1 19 59 21.0 −36 31 04 0.436 158.1 1 ... ... ... ... 11.58 9.44 8.40 11.07 10.19 9.31 /71 8.24 7.62 7.41 SCR1959-6236 1 19 59 33.6 −62 36 13 0.189 288.8 1 ... ... ... ... 17.48 15.36 12.68 16.27 14.82 12.96 /71 11.07 10.49 10.23 DEN2002-5425 1 20 02 13.4 −54 25 56 0.370 172.4 1 ... ... ... ... 19.39 17.21 13.86 ... ... ... ... 11.62 11.04 10.64 LHS3514 1 20 03 58.9 −08 07 47 0.551 243.5 1 ... ... ... ... 14.73 12.70 10.76 13.54 12.31 10.71 1/ 9.18 8.58c 8.29 GJ0774 2(1) 20 04 04.7 −65 36 01 0.856 170.9 1 .07612 .00636 2 18,63 12.35 ... ... 11.35 10.34 9.06 /5 7.80 7.28 7.06 LHS3516 1 20 04 06.8 −31 41 48 0.858 155.8 1 ... ... ... ... 15.43 13.60 11.26 ... ... ... ... 9.91 9.31 9.03 LP870-065 1 20 04 30.8 −23 42 02 0.377 155.9 1 ... ... ... ... 13.97 12.02 10.00 13.02 11.75 10.09 3/ 8.56 8.01 7.70 GJ0781.1 2(1) 20 07 45.0 −31 45 14 0.796 159.0 63 .06420 .00456 2 63,64 13.54 11.37 9.39 12.22 11.12 9.73 /5 8.27 7.68 7.40 LEHPM2-0064 1 20 07 55.2 −42 05 15 0.732 175.3 43 ... ... ... ... 15.70 13.39 10.75 14.30 12.96 11.20 1/ 9.52 8.96c 8.61 LTT07959 1 20 07 57.6 −01 32 28 0.435 124.1 1 ... ... ... ... 14.32 12.36 10.56 ... ... ... ... 9.59 8.99 8.75 LHS3525 1 20 08 07.5 −52 44 25 0.501 163.3 36 ... ... ... ... 14.36 12.28 10.43 ... ... ... ... 9.46 8.76 8.57 WT0682 1 20 08 23.8 −55 21 26 0.217 139.7 1 ... ... ... ... 15.46 13.90 12.11 ... ... ... ... 10.24 9.67 9.38 2MA2009-0113 1 20 09 18.2 −01 13 38 0.395 185.8 1 .09595 .00154 1 49 15.36 13.09 10.62 14.47 12.98 11.16 /49 9.40 8.83 8.51 L349-063 1 20 09 51.6 −47 31 34 0.369 173.0 1 ... ... ... ... 15.53 13.36 11.12 ... ... ... ... 9.93 9.31 9.01 LTT07991 1 20 11 06.7 −02 30 10 0.315 078.7 1 ... ... ... ... 14.73 12.96 11.17 ... ... ... ... 9.62 9.01 8.80 GJ0784 1 20 13 53.4 −45 09 51 0.760 094.1 1 .16135 .00099 2 63,64 8.82 6.21 5.21 7.95 7.04 6.13 /5 5.12 4.53c 4.28 LP754-031 1 20 13 59.5 −11 14 55 0.235 106.3 1 ... ... ... ... 13.11 11.22 9.72 ... ... ... ... 9.07 8.48 8.22 LHS3534 1 20 14 15.3 −54 49 15 0.544 137.5 1 ... ... ... ... 14.76 12.69 10.78 ... ... ... ... 9.75 9.18 8.92 L209-071 1 20 15 22.7 −56 45 54 0.353 185.3 1 ... ... ... ... 13.83 11.68 9.52 12.85 11.68 10.15 2/ 8.68 8.03 7.77 SCR2016-7531 1 20 16 11.3 −75 31 05 0.253 081.3 1 ... ... ... ... 17.07 14.75 12.25 15.84 14.28 12.35 /71 10.47 9.86 9.51 SCR2018-3635 1 20 18 06.5 −36 35 28 0.237 125.0 1 ... ... ... ... 16.31 14.07 11.47 14.63 13.38 11.75 /71 10.21 9.67 9.44 LP814-065 1 20 18 14.6 −20 12 48 0.377 115.7 1 ... ... ... ... 14.32 12.18 10.27 ... ... ... ... 9.46 8.84 8.58

– 57 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LEHPM2-0783 1 20 19 49.8 −58 16 43 0.347 181.9 1 .06193 .00102 1 49 18.64 16.35 12.87 17.17 15.28 13.03 /49 10.66 10.10 9.72 LP927-008 1 20 20 43.6 −28 06 07 0.198 280.8 1 ... ... ... ... 14.65 12.48 10.48 13.96 12.73 11.15 2/ 9.63 8.97 8.72 2MA2022-3653 1 20 22 01.8 −36 53 02 0.218 160.7 1 ... ... ... ... 16.98 14.84 12.49 ... ... ... ... 10.71 10.14 9.86 GJ0788.1 1 20 22 41.9 −58 17 09 0.862 122.4 1 .05151 .00188 2 63,64 11.67 9.66 8.52 10.57 9.67 8.81 /5 7.82 7.18 6.97 SCR2025-1534 1 20 25 08.6 −15 34 16 0.190 179.3 1 ... ... ... ... 13.33 11.23 9.29 12.70 11.62 10.25 2/ 8.92 8.30 8.05 SCR2025-2259 1 20 25 18.9 −22 59 06 0.191 219.5 1 ... ... ... ... 15.26 13.26 11.40 14.22 13.03 11.48 /71 10.00 9.48 9.16 SCR2025-3545 1 20 25 30.0 −35 45 46 0.242 268.7 1 ... ... ... ... 15.93 13.55 11.32 14.37 13.11 11.53 2/ 9.98 9.39 9.04 SCR2025-4207 1 20 25 41.3 −42 07 31 0.205 221.9 1 ... ... ... ... 13.86 11.73 9.63 13.16 12.08 10.72 1/ 9.41 8.73 8.51 LP927-017 1 20 25 51.6 −26 57 19 0.266 191.3 1 ... ... ... ... 14.24 12.07 10.61 ... ... ... ... 9.49 8.83 8.63 LEHPM2-0285 1 20 27 07.1 −44 21 29 0.470 163.7 1 ... ... ... ... 15.38 13.25 11.00 ... ... ... ... 10.08 9.48 9.16 L210-011 1 20 27 37.3 −54 52 59 0.312 307.6 1 ... ... ... ... 13.82 11.64 9.86 ... ... ... ... 8.77 8.16 7.92 GJ0791 1 20 27 41.7 −27 44 52 0.925 193.8 1 .06825 .00288 2 63,64 12.02 10.03 8.21 11.47 10.40 9.04 /5 7.71 7.08 6.86 GJ1252 1 20 27 42.1 −56 27 25 1.299 161.3 29 .05053 .00214 1 29 13.01 11.07 9.49 12.20 11.19 9.93 /29 8.70 8.16 7.92 GJ1251 1 20 28 03.7 −76 40 16 1.427 149.6 29 .07902 .00225 1 29 14.90 12.93 10.73 13.88 12.58 10.91 2/29u 9.36 8.88 8.60 L755-019 1 20 28 43.6 −11 28 31 0.186 117.6 1 .05318 .00167 1 49 13.22 10.97 8.28 12.47 11.31 9.81 /49 8.39 7.76 7.50 L080-175 1 20 29 06.9 −74 21 12 0.213 144.6 1 ... ... ... ... 13.68 11.73 10.26 ... ... ... ... 9.40 8.69 8.44 LEHPM2-1265 1 20 33 01.9 −49 03 11 0.261 150.4 1 ... ... ... ... 16.57 14.17 11.34 15.33 13.84 11.98 3/71u 10.11 9.52 9.19 LP755-027 1 20 33 32.3 −09 59 05 0.207 175.1 1 ... ... ... ... 14.82 12.67 10.98 ... ... ... ... 9.88 9.25 8.96 LP567-063 1 20 34 31.1 −32 31 00 0.211 168.9 1 ... ... ... ... 13.40 11.42 9.77 12.17 11.08 9.71 2/ 8.37 7.74 7.51 L162-190 1 20 34 52.9 −63 47 46 0.370 147.0 38 ... ... ... ... 14.34 12.03 10.15 ... ... ... ... 9.37 8.76 8.51 LHS3566 1 20 39 23.8 −29 26 35 0.808 155.6 1 .05726 .00268 1 10 18.95 16.50 13.68 17.62 15.67 13.64 /10 11.36 10.74 10.37 SCR2040-5501 1 20 40 12.4 −55 01 26 0.537 125.1 1 ... ... ... ... 16.61 14.39 12.15 15.22 13.91 12.22 /71 10.56 10.02 9.69 L567-074 1 20 42 43.4 −32 55 18 0.420 115.5 1 ... ... ... ... 11.79 9.76 8.29 ... ... ... ... 8.23 7.56 7.33 LP695-372 1 20 42 45.2 −05 00 19 0.261 065.3 1 ... ... ... ... 18.87 16.60 13.35 ... ... ... ... 11.45 10.87 10.54 GJ0800 1 20 42 57.2 −18 55 06 1.016 146.1 36 .05662 .00229 2 63,64 11.72 9.77 8.02 10.80 9.86 8.76 /5 7.56 6.95 6.74 GJ0803 3(1) 20 45 09.5 −31 20 27 0.451 130.9 1 .10097a .00100 4 63,63,6,64 9.82 7.68 5.96 8.65 7.68 6.61 3/ 5.44 4.83 4.53 LHS3580 1 20 45 45.4 −29 27 29 0.510 214.7 1 ... ... ... ... 14.54 12.38 10.38 ... ... ... ... 9.38 8.75 8.51 LHS3583 1 20 46 37.1 −81 43 14 0.732 137.0 1 .09472 .00238 1 47 12.58 10.06 8.71 11.50 10.39 9.02 /47 7.69 7.12 6.83 LP756-003 1 20 46 43.6 −11 48 13 0.360 098.8 1 .05350 .00130 1 55 14.61 12.41 10.20 13.80 12.52 10.88 2/ 9.35 8.73 8.44 LHS3585 1 20 47 22.6 −25 47 07 0.537 171.4 36 ... ... ... ... 14.59 12.38 10.64 ... ... ... ... 9.65 9.05 8.78 SIP2049-1716 1 20 49 52.7 −17 16 08 0.328 109.4 1 ... ... ... ... 18.72 17.26 14.00 ... ... ... ... 11.81 11.21 10.81 LEP2050-3424 1 20 50 16.2 −34 24 43 0.533 137.5 35 ... ... ... ... 14.34 12.13 9.54 13.74 12.31 10.55 2/ 8.82 8.27 8.00 GJ0808 1 20 51 41.6 −79 18 40 1.234 142.4 1 .05712 .00209 2 30,63 13.06 10.81 9.43 11.81 10.82 9.64 /30 8.46 7.91 7.66 LP816-060 1 20 52 33.0 −16 58 29 0.308 275.7 28 .17503 .00340 1 64 12.42 9.62 7.56 11.50 10.25 8.64 3/ 7.09 6.52 6.20 2MA2053-0133 1 20 53 09.1 −01 33 04 0.416 121.6 39 .05500 .00200 1 55 ... ... 11.29 15.80 14.34 12.45 1/ 10.66 10.11 9.79 LP636-019 1 20 53 14.7 −02 21 22 0.231 097.9 1 ... ... ... ... 13.75 11.23 9.23 ... ... ... ... 9.33 8.71 8.45 LEHPM1-3996 1 20 53 28.0 −73 08 10 0.200 151.6 1 ... ... ... ... 13.84 11.67 10.02 ... ... ... ... 9.13 8.58 8.35 LEHPM2-5514 1 20 54 15.0 −53 29 56 0.191 192.6 1 ... ... ... ... 13.14 10.92 9.69 ... ... ... ... 8.86 8.22 8.05 GJ0810 3(2) 20 55 37.8 −14 02 08 1.298 108.2 29 .07765a .00085 3 30,30,6 13.56J 11.65J 9.55J 12.48J 11.23J 9.62J /30 8.12J 7.64J 7.37J LP636-060 1 20 56 04.1 −02 12 20 0.276 135.0 1 ... ... ... ... 14.57 12.48 10.68 ... ... ... ... 9.59 9.03 8.74 LP872-027 1 20 56 27.2 −24 00 13 0.402 112.4 1 ... ... ... ... 16.33 14.15 11.60 15.16 13.79 12.00 /45 10.25 9.69 9.38 GJ0811.1 1 20 56 46.6 −10 26 55 1.131 182.1 28 .06300 .00295 2 63,64 12.10 9.85 7.98 11.50 10.44 9.11 /5 7.77 7.14 6.88 L424-030 1 21 00 54.9 −41 31 44 0.432 123.0 1 ... ... ... ... 14.95 12.57 10.25 ... ... ... ... 9.49 8.84 8.60 APM2101-4125 1 21 01 03.8 −41 14 33 0.433 125.9 1 ... ... ... ... 15.64 13.34 11.03 ... ... ... ... 9.97 9.38 9.09 WT0766 1 21 01 07.4 −49 07 25 0.372 233.2 1 ... ... ... ... 14.21 11.78 9.80 ... ... ... ... 9.12 8.48 8.19 GJ0816 1 21 01 58.6 −06 19 08 0.482 205.0 1 .06964 .00258 2 63,64 11.03 8.97 6.80 11.24 10.18 8.86 /5 7.56 6.95 6.69 L163-023 1 21 02 25.0 −60 31 36 0.227 133.9 1 ... ... ... ... 13.52 12.08 10.27 11.96 10.97 9.79 3/ 8.64 7.92 7.71 LTT08345 1 21 02 40.7 −18 31 17 0.360 108.8 1 ... ... ... ... 11.91 9.40 8.43 ... ... ... ... 8.22 7.63 7.41 GJ2151 1 21 03 13.9 −56 57 48 0.466 316.1 1 .07503 .00560 2 63,64 14.05 11.75 9.98 12.80 11.63 10.17 /34 8.73 8.18 7.90

– 58 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS3615 1 21 03 21.7 −50 22 52 0.495 142.0 1 ... ... ... ... 13.84 11.60 9.71 13.10 11.96 10.48 3/ 9.11 8.46 8.19 GJ0817 1 21 04 53.4 −16 57 32 2.234 204.2 28 .05580 .00253 2 63,64 12.45 10.41 8.99 11.45 10.50 9.42 /5 8.29 7.74 7.55 L281-046 1 21 04 53.9 −52 48 34 0.326 182.7 1 ... ... ... ... 14.72 12.75 10.94 13.66 12.52 11.08 /71 9.72 9.10 8.83 LEHPM2-0801 1 21 05 13.8 −55 03 56 0.334 171.0 1 ... ... ... ... 15.01 12.96 10.76 13.97 12.69 11.05 /71 9.59 8.92 8.64 L280-056 1 21 06 26.9 −51 42 37 0.385 237.2 1 ... ... ... ... 13.37 11.12 9.58 ... ... ... ... 8.96 8.30 8.08 APM2109-4003 1 21 08 31.3 −40 03 49 0.622 133.4 1 ... ... ... ... 15.17 13.00 10.97 14.11 12.95 11.41 1/ 9.93 9.39 9.11 GJ0821 1 21 09 17.4 −13 18 09 2.118 160.3 28 .08197 .00190 2 63,64 11.95 9.79 8.42 10.87 9.91 8.83 /5 7.69 7.12 6.91 LP873-009 1 21 11 13.7 −22 48 18 0.358 181.7 1 ... ... ... ... 16.00 13.68 11.14 14.67 13.39 11.69 /45 9.99 9.44 9.12 LP757-092 1 21 11 24.2 −09 40 33 0.379 189.5 1 ... ... ... ... 17.36 15.30 12.69 16.56 14.92 12.96 /46 10.94 10.28 9.95 LHS3639 1 21 11 49.6 −43 36 49 0.741 161.7 1 .06334 .00341 2 63,64 12.63 10.56 8.88 12.00 10.96 9.73 /34 8.48 7.92 7.67 WT2203 1 21 14 14.0 −07 02 50 0.326 184.2 1 ... ... ... ... 15.58 13.49 11.20 ... ... ... ... 9.96 9.34 9.06 GJ0825 1 21 17 15.3 −38 52 03 3.453 250.5 36 .25344 .00080 2 63,64 7.60 5.54 4.27 6.67 5.77 4.91 /5 4.05c 3.26c 3.10c L117-123 1 21 20 09.8 −67 39 06 0.455 280.9 1 .04807 .00213 3 63,63,64 12.23 10.05 8.64 10.90 9.93 8.86 /34 7.72 7.07 6.83 SCR2122-4314 1 21 22 16.9 −43 14 05 0.262 184.7 1 ... ... ... ... 14.26 12.06 10.01 13.39 12.17 10.61 /71 9.13 8.53 8.21 GJ0826.2 1 21 24 18.4 −46 41 35 0.739 094.0 28 .04075 .00440 2 63,64 13.41 11.11 9.47 12.47 11.43 10.21 /5 8.97 8.41 8.14 APM2127-3844 1 21 27 04.6 −38 44 51 0.927 142.6 1 .04925 .00138 1 47 15.75 13.46 11.41 14.60 13.31 11.66 /47 10.03 9.56 9.28 GJ0828.2 1 21 27 16.9 −06 50 39 0.417 174.7 1 .06092 .00235 2 63,64 11.67 9.07 8.08 11.10 10.15 9.15 /5 8.05 7.46c 7.17 HB2124-4228 1 21 27 26.1 −42 15 18 0.191 132.5 1 .04230 .00360 1 63 21.58 19.19 16.03 ... 18.52 16.12 /40 13.32 12.67 12.19 LTT08524 1 21 27 58.5 −00 39 50 0.373 211.0 37 ... ... ... ... 12.48 10.47 9.23 ... ... ... ... 8.78 8.17c 7.91 L714-046 1 21 28 18.3 −22 18 32 0.343 218.3 1 ... ... ... ... 12.78 10.51 9.07 12.17 11.11 9.81 2/ 8.50 7.92 7.63 LP817-050 1 21 28 41.1 −14 31 04 0.271 146.1 1 ... ... ... ... 12.92 10.76 9.31 ... ... ... ... 8.94 8.33 8.09 LP817-054 1 21 29 23.4 −18 55 08 0.205 188.1 1 ... ... ... ... 18.14 15.69 12.80 ... ... ... ... 11.26 10.64 10.30 SCR2130-7710 1 21 30 07.0 −77 10 38 0.589 118.0 59 ... ... ... ... 18.24 15.63 13.48 17.01 15.33 13.31 /71 11.29 10.67 10.37 LHS0510 1 21 30 47.7 −40 42 30 1.759 143.4 1 .08360 .00252 1 29 14.10 12.05 10.04 13.12 11.92 10.35 2/29u 8.87 8.42 8.13 GJ0831 2 21 31 18.6 −09 47 26 1.194 091.0 63 .12512 .00215 2 63,64 12.63J 10.81J 8.38J 12.02J 10.70J 9.00J 3/ 7.32J 6.70J 6.38J LP698-002 1 21 32 29.8 −05 11 59 0.373 160.3 1 ... ... ... ... 18.38 15.78 12.96 ... ... ... ... 11.42 10.73 10.38 GJ0832 1 21 33 34.0 −49 00 33 0.800 183.9 36 .20203 .00100 2 63,64 9.18 6.58 5.71 8.66 7.66 6.48 /5 5.35 4.77c 4.50 LHS3689 1 21 33 48.9 −06 51 10 0.519 167.7 36 ... ... ... ... 14.76 12.31 10.20 ... ... ... ... 9.56 8.94c 8.66 L164-131 1 21 34 03.8 −63 11 07 0.299 122.9 1 ... ... ... ... 14.90 12.77 10.88 ... ... ... ... 9.80 9.22 8.95 WT0792 1 21 34 22.3 −43 16 11 0.827 168.6 1 ... ... ... ... 17.39 15.06 12.28 16.38 14.74 12.76 1/ 10.69 10.04 9.69 L164-124 1 21 34 52.2 −63 01 08 0.205 142.5 1 ... ... ... ... 14.62 12.69 10.46 ... ... ... ... 9.68 9.02 8.74 SIP2135-3855 1 21 35 16.2 −38 55 48 0.291 157.5 1 ... ... ... ... 15.89 13.61 11.38 14.81 13.53 11.92 1/ 10.35 9.75 9.46 SCR2135-5325 1 21 35 39.6 −53 25 32 0.191 332.4 1 ... ... ... ... 17.43 15.07 12.30 15.88 14.39 12.54 /71 10.80 10.25 9.92 WT0795 1 21 36 25.3 −44 01 00 0.827 144.4 47 .06953 .00070 1 47 15.16 12.80 10.66 14.15 12.80 11.08 /47 9.46 8.83 8.53 HIP106803 1 21 37 55.7 −63 42 43 0.190 245.0 1 .04706 .00255 1 64 11.70 9.65 8.37 10.62 9.67 8.62 /34 7.51 6.82 6.64 LHS0512 1 21 38 43.7 −33 39 55 1.160 117.4 1 .08202 .00210 1 29 13.40 11.60 9.29 12.55 11.37 9.88 2/29u 8.44 7.84 7.57 GJ0836 1 21 39 00.9 −24 09 29 1.257 126.2 1 ... ... ... ... 14.33 12.25 10.39 13.45 12.27 10.70 /5 9.19 8.61 8.36 L081-009 1 21 41 03.8 −69 45 35 0.420 258.9 1 ... ... ... ... 14.51 12.40 10.58 ... ... ... ... 9.55 8.99 8.67 LTT08678 1 21 45 00.8 −05 47 13 0.457 200.0 1 ... ... ... ... 13.29 11.11 9.35 ... ... ... ... 9.03 8.46 8.19 LP874-061 1 21 45 26.7 −21 33 58 0.315 128.2 1 ... ... ... ... 13.03 10.87 9.73 ... ... ... ... 8.91 8.32 8.05 L002-077 1 21 46 40.4 −85 43 05 0.308 129.0 1 ... ... ... ... 13.87 11.12 9.71 13.39 12.13 10.44 2/ 8.84 8.28 7.99 GJ1263 2(1) 21 46 42.7 −00 10 24 0.944 121.8 1 .08350 .00390 1 63 13.68 11.57 9.49 12.64 11.43 9.87 /69 8.36 7.83 7.49 LP874-062 1 21 46 45.5 −21 17 47 0.300 100.1 1 ... ... ... ... 14.71 12.52 10.45 13.66 12.43 10.82 /45 9.29 8.71 8.38 LP698-042 1 21 47 17.5 −04 44 41 0.273 089.9 1 ... ... ... ... 14.88 12.35 10.05 ... ... ... ... 9.42 8.84 8.50 LP818-034 1 21 48 53.0 −19 47 27 0.318 096.1 1 ... ... ... ... 16.09 13.77 11.40 14.85 13.55 11.82 /45 10.13 9.51 9.21 GJ1264 2 21 49 05.9 −72 06 08 0.459 127.4 1 .06129 .00154 1 64 10.74J 8.62J 7.38J 9.62J 8.68J 7.64J /34 6.54J 5.84J 5.65J L427-034 2 21 49 11.4 −41 33 30 0.365 124.0 1 ... ... ... ... 12.19J 9.94J 8.20J 11.55J 10.39J 9.02J 2/ 7.75J 7.17J 6.88J LHS3719 1 21 49 25.9 −63 06 52 0.558 038.3 1 .06028 .00137 1 47 13.32 11.41 9.69 12.56 11.45 10.08 /47 8.74 8.12 7.89 WT0818 1 21 49 44.8 −41 38 33 0.185 107.6 1 ... ... ... ... 14.58 12.36 10.29 13.56 12.36 10.85 1/ 9.39 8.87 8.54

– 59 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LP638-050 1 21 51 27.0 −01 27 14 0.223 084.0 37 ... ... ... ... 18.15 15.93 13.09 ... ... ... ... 11.28 10.74 10.39 SCR2154-4754 1 21 54 02.5 −47 54 02 0.190 069.3 1 ... ... ... ... 16.46 14.32 12.00 15.43 14.07 12.37 1/ 10.71 10.13 9.84 LP818-054 1 21 55 02.2 −20 14 27 0.243 061.1 1 ... ... ... ... 15.34 13.10 11.07 ... ... ... ... 9.98 9.44 9.10 LP983-034 1 21 55 48.4 −33 13 15 0.225 161.7 1 ... ... ... ... 13.30 11.25 9.40 ... ... ... ... 8.60 7.98 7.70 LP758-062 1 21 56 19.8 −10 20 17 0.411 227.2 1 ... ... ... ... 15.67 13.66 11.33 14.59 13.27 11.52 /45 9.93 9.39 9.09 LHS0516 1 21 56 55.3 −01 54 09 1.417 064.9 1 .07480 .00320 1 63 15.28 13.36 11.08 14.65 13.29 11.52 /69 9.88 9.32 9.03 LP759-006 1 21 57 12.7 −09 03 27 0.224 126.0 1 ... ... ... ... 16.34 14.24 11.88 15.11 13.73 11.94 /45 10.14 9.51 9.24 LHS3735 1 21 57 39.3 −09 28 13 0.534 251.3 36 ... ... ... ... 16.19 14.12 12.02 14.84 13.60 11.98 /69 10.45 9.82 9.54 LHS3739 3(1) 21 58 50.2 −32 28 18 0.542 223.7 1 .05092a .00077 2 47,47 15.67 13.38 11.07 14.72 13.45 11.88 /47 10.39 9.83 9.56 GJ0842 1 21 59 34.7 −59 45 10 0.895 097.9 28 .08328 .00174 2 63,64 10.57 8.56 7.02 9.74 8.78 7.75 /5 6.61 5.99 5.76 GJ0843 1 22 02 00.8 −19 28 59 0.923 086.6 1 ... ... ... ... 12.82 10.23 8.84 12.03 10.89 9.45 /5 8.05 7.50c 7.19 LP759-017 1 22 02 11.3 −11 09 46 0.234 145.3 1 ... ... ... ... 20.11 17.87 14.88 ... ... ... ... 12.36 11.71 11.37 LHS3746 1 22 02 29.4 −37 04 51 0.843 101.3 1 .13429 .00131 1 25 12.42 10.35 8.20 11.76 10.56 9.04 /25 7.60 7.02 6.72 LTT18559 1 22 02 31.3 −00 17 10 0.527 115.4 1 ... ... ... ... 15.24 13.15 10.82 ... ... ... ... 10.02 9.40 9.11 LP875-009 1 22 03 20.0 −25 21 52 0.355 230.4 1 ... ... ... ... 13.72 11.16 9.86 ... ... ... ... 9.03 8.49 8.25 LHS3748 1 22 03 27.1 −50 38 38 0.589 142.7 1 .05015 .00427 1 18 13.44 11.27 9.64 12.10 11.08 9.86 /34 8.63 8.04 7.81 LP759-025 1 22 05 35.7 −11 04 29 0.320 236.8 1 ... ... ... ... 18.93 16.53 13.76 ... ... ... ... 11.66 11.05 10.72 LTT08848 2(1) 22 05 51.3 −11 54 51 0.340 236.6 1 .04500 .00268 1 64 11.32 9.11 7.95 10.15 9.25 8.33 /66 7.22 6.60 6.40 LHS3756 1 22 05 54.4 −38 16 06 0.783 133.7 1 ... ... ... ... 13.18 10.98 9.27 ... ... ... ... 8.80 8.26 8.04 LP699-032 1 22 06 09.6 −07 23 36 0.294 141.0 1 ... ... ... ... 17.45 15.17 12.49 ... ... ... ... 10.67 10.06 9.76 WT0870 1 22 06 40.7 −44 58 07 0.753 216.9 1 .05651 .00113 1 47 15.66 13.36 10.95 14.43 13.10 11.40 /47 9.76 9.18 8.89 L283-001 1 22 06 57.2 −49 49 42 0.385 084.4 1 ... ... ... ... 14.42 12.33 10.48 ... ... ... ... 9.34 8.72 8.45 LP983-102 1 22 07 53.9 −37 04 24 0.269 249.7 1 ... ... ... ... 13.96 11.71 9.97 ... ... ... ... 9.27 8.69 8.43 LP1032-066 1 22 08 16.2 −42 42 59 0.468 156.4 1 ... ... ... ... 13.71 11.60 10.11 12.68 11.62 10.32 /45 9.05 8.47 8.19 LTT08875 1 22 08 32.4 −08 24 52 0.353 146.2 1 ... ... ... ... 14.15 11.96 10.41 ... ... ... ... 9.23 8.57 8.37 L024-098 1 22 08 38.6 −83 03 29 0.309 089.6 1 ... ... ... ... 13.41 11.47 10.15 ... ... ... ... 9.04 8.47 8.22 GJ0849 1 22 09 40.3 −04 38 27 1.083 090.9 1 .11145 .00175 2 63,64 11.64 9.21 7.55 10.38 9.27 7.87 3/ 6.51 5.90 5.59 LEHPM1-4416 1 22 10 13.2 −71 46 07 0.560 091.4 42 ... ... ... ... 15.90 13.68 11.32 14.53 13.20 11.54 1/ 9.98 9.42 9.11 LTT08900 1 22 11 13.5 −02 32 37 0.434 102.3 1 ... ... ... ... 13.38 11.36 10.10 ... ... ... ... 8.69 8.14c 7.82 LTT08905 1 22 11 56.9 −07 42 57 0.441 072.5 1 ... ... ... ... 13.77 11.66 10.24 ... ... ... ... 9.24 8.58 8.36 LTT08914 2(1) 22 13 28.8 −14 44 54 0.412 225.5 1 ... ... ... ... 14.21 12.49 10.60 13.34 12.22 10.79 /70 9.45 8.82c 8.53 GJ1265 1 22 13 42.9 −17 41 09 0.928 110.9 1 .09600 .00390 1 63 14.57 12.40 9.96 13.57 12.27 10.58 /69 8.96 8.42 8.12 WT0887 1 22 13 50.5 −63 42 10 0.201 038.4 1 ... ... ... ... 18.28 15.79 12.59 ... ... ... ... 10.92 10.30 9.94 LP875-068 1 22 14 38.4 −21 41 53 0.274 035.2 1 ... ... ... ... 11.37 8.65 8.05 10.38 9.50 8.61 1/ 7.54 6.90 6.72 LP984-001 1 22 17 19.0 −34 44 03 0.496 165.9 1 ... ... ... ... 16.75 14.16 11.67 15.48 13.94 12.02 1/ 10.15 9.53 9.17 GJ0852 3(1) 22 17 19.2 −08 48 13 0.569 237.4 1 .09960 .00330 1 63 13.25 10.94 8.96 13.48 12.18 10.54 /5 9.02 8.49c 8.17 LHS3789 1 22 17 53.3 −36 11 20 0.558 166.3 1 ... ... ... ... 15.38 13.07 11.09 ... ... ... ... 9.93 9.36 9.09 LHS3793 1 22 19 23.7 −28 23 21 0.871 111.7 1 ... ... ... ... 15.79 13.64 11.40 ... ... ... ... 10.17 9.64 9.36 LP931-042 1 22 20 24.7 −27 05 52 0.438 099.6 1 ... ... ... ... 13.63 11.49 10.49 ... ... ... ... 9.25 8.58 8.44 LHS5384 1 22 21 49.7 −42 09 03 0.535 195.8 1 ... ... ... ... 15.94 13.74 11.56 14.74 13.46 11.81 /45 10.21 9.64 9.35 LP931-048 1 22 21 53.4 −31 31 23 0.296 110.8 1 ... ... ... ... 14.56 12.46 10.58 ... ... ... ... 9.48 8.89 8.60 LEHPM1-4635 1 22 22 43.5 −72 15 44 0.320 134.2 1 ... ... ... ... 16.17 13.99 11.64 ... ... ... ... 10.38 9.79 9.51 LHS3799 1 22 23 07.0 −17 36 26 0.787 157.0 1 .13769 .00175 2 49,63 14.23 11.76 9.27 13.30 11.87 10.04 /49 8.24 7.64 7.32 LP931-053 1 22 23 14.0 −27 23 58 0.441 221.0 37 ... ... ... ... 14.15 12.00 10.57 ... ... ... ... 9.13 8.60 8.33 GJ0855 1 22 23 33.3 −57 13 14 0.721 122.0 1 .05245 .00211 2 63,64 11.65 9.39 7.97 10.72 9.77 8.72 /5 7.60 6.96 6.73 LP931-057 2 22 23 46.3 −28 06 50 0.183 067.6 1 ... ... ... ... 14.70J 12.69J 10.66J ... ... ... ... 9.65J 9.05J 8.83J LP1033-011 1 22 24 56.7 −38 31 10 0.303 163.2 1 ... ... ... ... 12.95 11.04 9.64 ... ... ... ... 9.00 8.33 8.13 LHS3804 1 22 25 05.1 −47 52 47 0.838 134.1 1 ... ... ... ... 13.16 11.20 9.07 12.51 11.31 9.82 /46 8.34 7.73 7.43 LEHPM1-4728 1 22 27 27.1 −35 00 51 0.240 197.3 1 ... ... ... ... 14.81 12.67 10.77 ... ... ... ... 9.77 9.16 8.88

– 60 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LP876-026 2 22 28 23.4 −25 54 08 0.329 173.7 1 .04900 .00647 1 64 13.02J 10.85J 9.00J 12.08J 10.93J 9.46J /34 8.34c 7.58 7.45c LHS0523 1 22 28 54.4 −13 25 19 1.083 196.5 36 .08880 .00490 1 63 18.19 15.78 12.64 16.90 14.90 12.56 /6 10.77 10.22 9.84 LEHPM1-4771 1 22 30 09.5 −53 44 56 0.745 185.2 1 ... ... ... ... 15.81 13.57 11.20 14.47 13.09 11.30 3/ 9.54 8.96 8.63 SCR2230-5244 1 22 30 28.0 −52 44 29 0.333 123.3 1 ... ... ... ... 19.02 16.34 14.13 17.37 15.91 13.88 /71 11.85 11.24 10.91 LP876-034 1 22 34 00.5 −25 14 33 0.325 198.8 1 .06220 .00307 1 64 12.64 10.44 8.84 11.29 10.23 8.98 2/ 7.73 7.14 6.88 L166-044 1 22 34 04.6 −61 07 41 0.241 092.2 1 ... ... ... ... 16.18 14.01 11.73 ... ... ... ... 10.14 9.60 9.34 LHS0526 1 22 34 53.7 −01 04 58 1.136 078.8 1 .04250 .00370 1 63 15.96 13.78 10.90 14.83 13.56 11.91 /69 10.39 9.78 9.52 LTT09084 1 22 35 04.9 −42 17 48 0.307 120.1 1 ... ... ... ... 14.40 12.30 10.34 13.34 12.12 10.56 1/ 9.10 8.47 8.21 GJ0864 1 22 36 09.7 −00 50 30 0.628 174.6 28 .05871 .00174 2 63,64 10.15 8.10 6.88 9.99 9.09 8.12 /5 7.04 6.37 6.16 L645-074 2(1) 22 38 24.7 −29 21 14 0.260 183.0 37 ... ... ... ... 11.71 8.52 7.55 10.93 9.89 8.64 3/ 7.41 6.81 6.57 GJ0865 2 22 38 29.8 −65 22 42 0.815 101.5 1 .07834 .00524 2 63,64 12.12J 10.25J 8.01J 11.48J 10.30J 8.77J /5 7.27J 6.72J 6.43J GJ0866 3 22 38 33.6 −15 17 59 3.254 046.8 36 .28950 .00440 1 63 13.01J 10.60J 7.19J 12.37J 10.70J 8.64J /6 6.55J 5.95J 5.54J GJ0867 4(2) 22 38 45.6 −20 37 16 0.456 100.0 28 .11501 .00130 2 63,64 10.36J ... ... 9.09J 8.08J 6.88J /5 5.67J 5.11J 4.80J L083-030 1 22 40 42.9 −71 31 11 0.410 245.6 1 ... ... ... ... 11.96 10.09 8.96 ... ... ... ... 8.18 7.55c 7.36 LHS3844 1 22 41 58.1 −69 10 08 0.785 157.1 36 ... ... ... ... 16.38 14.14 11.62 ... ... ... ... 10.05 9.48 9.15 LEHPM1-5031 1 22 41 59.4 −75 00 33 0.227 341.5 1 ... ... ... ... 17.27 14.77 12.07 ... ... ... ... 10.43 9.90 9.60 L166-003 1 22 42 00.1 −59 15 13 0.334 091.5 1 ... ... ... ... 15.34 13.44 11.25 ... ... ... ... 9.83 9.28 9.01 LP820-060 1 22 43 02.0 −20 07 18 0.320 098.0 1 ... ... ... ... 14.96 12.81 11.08 ... ... ... ... 9.70 9.12 8.86 LP876-008 1 22 43 23.1 −24 24 52 0.327 139.4 1 ... ... ... ... 16.28 14.12 11.77 ... ... ... ... 10.25 9.67 9.41 GJ0871.1 2(1) 22 44 58.0 −33 15 02 0.230 123.1 1 .04382 .00231 2 55,64 12.50 10.48 8.13 12.11 10.91 9.32 3/ 7.79 7.15 6.93 G156-046 1 22 45 06.1 −12 23 43 0.193 048.5 1 ... ... ... ... 14.68 12.59 10.21 ... ... ... ... 9.68 9.05 8.79 LP821-016 1 22 46 23.8 −16 56 53 0.228 189.1 1 ... ... ... ... 13.15 11.10 9.18 12.61 11.58 10.30 /45 9.06 8.49c 8.21 LHS3850 1 22 46 26.4 −06 39 26 0.865 128.0 36 .05330 .00460 1 63 16.92 14.49 11.77 ... ... ... ... 10.79 10.19 9.85 GJ0874 1 22 48 17.4 −36 47 23 0.804 109.0 1 ... ... ... ... 12.35 10.42 8.81 11.90 10.89 9.68 /5 8.48 7.87 7.63 LP932-081 1 22 48 38.4 −31 08 41 0.457 102.5 1 ... ... ... ... 13.12 10.88 9.27 12.33 11.21 9.79 1/ 8.41 7.82 7.49 LP932-083 1 22 49 08.4 −28 51 20 0.292 213.3 1 ... ... ... ... 14.68 12.59 10.57 13.94 12.67 10.98 3/ 9.34 8.78c 8.47 LP985-032 1 22 51 23.7 −34 19 36 0.312 125.6 1 ... ... ... ... 11.89 9.75 8.32 11.52 10.55 9.47 /45 8.36 7.75 7.49 LP821-027 1 22 52 05.2 −15 32 51 0.316 083.9 1 ... ... ... ... 15.77 13.37 10.90 15.08 13.74 11.96 /45 10.24 9.69 9.37 SCR2252-6905 1 22 52 19.2 −69 05 48 0.262 102.1 1 ... ... ... ... 16.83 14.83 12.39 15.72 14.38 12.65 1/ 10.93 10.31 10.02 SCR2252-2220 1 22 52 25.8 −22 20 07 0.299 187.6 1 ... ... ... ... 14.95 12.82 10.85 13.71 12.56 11.10 /71 9.70 9.11 8.86 LHS5394 1 22 52 48.1 −28 47 43 0.461 229.7 1 .05099 .00284 1 64 13.04 10.42 9.43 11.87 10.85 9.65 /34 8.41 7.82c 7.58 GJ0876 1 22 53 16.8 −14 15 49 1.172 125.0 28 .21447 .00057 3 3,63,64 11.15 8.68 7.23 10.18 8.97 7.40 3/ 5.93 5.35 5.01 SCR2253-1238 1 22 53 42.8 −12 38 43 0.184 099.3 1 ... ... ... ... 13.49 10.90 9.78 12.58 11.55 10.31 1/ 9.02 8.40 8.17 LEHPM1-5263 1 22 53 50.9 −71 28 07 0.318 120.8 1 ... ... ... ... 17.38 15.29 12.67 ... ... ... ... 10.85 10.30 9.96 LHS3872 1 22 54 46.5 −05 28 26 0.675 055.4 1 .04242 .00452 2 57,63 14.60 12.34 10.43 13.89 12.67 11.12 2/ 9.65 9.09 8.81 HIP113201 1 22 55 27.2 −52 18 10 0.185 132.8 1 .04034 .00284 1 64 12.49 10.36 8.99 11.51 10.53 9.44 /34 8.32 7.66c 7.42 GJ0877 1 22 55 45.5 −75 27 31 1.420 225.6 36 .11613 .00118 2 63,64 11.56 9.39 7.47 10.38 9.31 7.95 /5 6.62 6.08 5.81 GJ1277 1 22 56 24.7 −60 03 49 1.082 210.4 30 .09748 .00117 1 30 15.40 13.19 10.65 14.00 12.59 10.79 /30 8.98 8.36 8.11 LP761-006 1 22 56 26.2 −11 09 39 0.463 055.3 1 ... ... ... ... 16.27 14.17 12.29 ... ... ... ... 10.50 9.92 9.63 L718-071 2(1) 23 00 33.4 −23 57 10 0.382 150.5 1 .04910a .00238 2 64,64 12.81 10.31 9.24 11.55 10.55 9.43 1/ 8.25 7.67 7.41 LP877-045 1 23 00 36.7 −26 04 56 0.334 084.5 1 ... ... ... ... 14.52 12.17 10.83 ... ... ... ... 9.54 9.00 8.75 LP933-037 1 23 01 23.9 −26 49 47 0.265 085.1 1 ... ... ... ... 16.73 14.58 12.35 ... ... ... ... 10.74 10.16 9.88 L215-016 1 23 01 32.5 −55 30 18 0.338 052.8 1 ... ... ... ... 14.06 12.24 10.25 12.65 11.57 10.25 /71 8.98 8.36 8.13 LP701-056 1 23 01 46.2 −06 14 23 0.199 114.4 1 ... ... ... ... 14.28 12.12 10.12 ... ... ... ... 9.49 8.90 8.65 L286-074 1 23 01 49.5 −53 17 08 0.269 144.1 1 ... ... ... ... 14.46 12.58 10.75 ... ... ... ... 9.39 8.74 8.50 LP821-054 1 23 03 59.7 −16 12 07 0.354 192.5 1 ... ... ... ... 15.73 13.62 11.46 14.63 13.38 11.77 /45 10.21 9.66 9.29 GJ0887 1 23 05 52.1 −35 51 11 6.907 078.9 36 .30508 .00070 2 63,64 8.00 6.91 5.28 7.34 6.37 5.32 /5 4.34c 3.61c 3.47c L1007-017 1 23 06 27.8 −00 29 38 0.496 235.5 1 ... ... ... ... 13.27 11.24 9.51 ... ... ... ... 9.08 8.40 8.16 2MA2306-0502 1 23 06 29.4 −05 02 29 1.036 117.1 11 .08258 .00258 1 11 19.88 17.32 13.58 18.75 16.54 14.10 3/ 11.35 10.72 10.30

– 61 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

SSS2307-5009 1 23 06 58.8 −50 08 59 0.437 087.4 1 .04659 .00157 1 16 22.80 19.74 16.69 20.67 19.02 16.60 /16 13.39 12.70 12.24 SCR2307-8452 1 23 07 19.7 −84 52 04 0.613 097.2 59 ... ... ... ... 16.33 14.16 11.83 15.13 13.76 12.00 /71 10.36 9.81 9.47 LHS3898 1 23 07 46.8 −27 54 23 0.743 101.5 1 ... ... ... ... 13.47 10.97 9.82 ... ... ... ... 8.80 8.21 7.92 LTT09381 1 23 09 39.3 −01 58 24 0.449 143.0 37 ... ... ... ... 13.22 11.24 9.23 ... ... ... ... 8.67 8.01 7.80 GJ1279 1 23 09 40.9 −67 43 58 0.372 238.9 1 .06674 .00083 1 64 9.45 7.52 6.56 ... ... ... ... 6.08 5.46 5.33 LTT09388 1 23 10 00.3 −21 11 43 0.331 089.5 1 ... ... ... ... 13.67 11.52 9.82 12.77 11.66 10.22 2/ 8.86 8.24 8.00 L120-181 1 23 10 20.7 −69 12 22 0.229 096.5 1 ... ... ... ... 13.18 11.17 9.79 ... ... ... ... 8.89 8.26 8.06 GJ1281 1 23 10 42.2 −19 13 35 1.443 177.1 1 .04114 .00231 1 29 13.45 11.39 9.92 12.45 11.42 10.19 /29 8.98 8.46 8.23 LEHPM1-5562 1 23 10 54.9 −38 02 01 0.343 105.4 1 ... ... ... ... 13.93 11.71 9.97 ... ... ... ... 9.38 8.71 8.51 LP822-037 1 23 11 57.8 −17 01 59 0.206 096.3 1 ... ... ... ... 14.97 12.71 10.77 ... ... ... ... 9.57 8.96 8.70 LHS3909 1 23 12 11.3 −14 06 12 0.755 196.3 1 .05490 .00200 1 47 13.93 11.20 9.89 12.97 11.82 10.40 /47 9.06 8.48 8.22 LTT09412 1 23 13 01.8 −05 31 10 0.240 093.6 1 ... ... ... ... 12.96 10.61 9.55 ... ... ... ... 8.86 8.20 7.97 GJ2154 2 23 14 16.7 −19 38 39 0.459 083.3 1 .05042 .00214 1 64 11.26J 9.01J 7.79J 10.49 9.53 8.56 1/ 7.47 6.80 6.62 LEHPM1-5625 1 23 15 02.0 −35 28 25 0.325 059.0 1 ... ... ... ... 14.45 12.01 9.95 ... ... ... ... 9.24 8.70 8.40 LHS3918 1 23 15 43.8 −12 21 49 0.578 115.4 1 ... ... ... ... 13.70 11.74 9.98 ... ... ... ... 9.26 8.63c 8.39 LHS0539 1 23 15 51.6 −37 33 31 1.311 078.4 29 .05285 .00201 1 29 15.97 13.81 11.56 14.97 13.66 11.98 3/29u 10.40 9.87 9.59 LP702-050 1 23 15 54.5 −06 27 46 0.321 101.5 1 ... ... ... ... 18.06 15.94 13.13 ... ... ... ... 11.11 10.57 10.23 LHS3916 2 23 15 57.2 −81 22 21 0.502 079.2 28 .04452 .00131 1 64 11.61J 9.49J 8.24J 10.00J 9.12J 8.23J /34 7.19J 6.58J 6.35J LTT09448 1 23 16 36.7 −01 30 48 0.304 191.8 1 ... ... ... ... 15.05 13.01 11.14 ... ... ... ... 9.82 9.19 8.91 L719-021 1 23 17 00.2 −23 23 47 0.370 128.5 1 .04686 .00170 1 64 12.13 9.76 8.94 10.85 9.96 9.10 /34 8.10 7.45 7.25 LTT09461 1 23 17 21.8 −25 42 21 0.316 222.2 1 ... ... ... ... 14.92 12.76 11.14 ... ... ... ... 9.88 9.29 9.02 LTT09462 1 23 17 25.5 −40 26 46 0.290 114.7 1 ... ... ... ... 14.09 12.26 10.25 13.06 11.96 10.56 2/ 9.24 8.57 8.35 LHS3925 1 23 17 50.3 −48 18 47 0.756 157.5 47 .04685 .00117 1 47 14.83 12.50 10.53 13.61 12.44 10.92 /47 9.53 8.97c 8.71 G273-014 1 23 19 35.6 −08 53 17 0.274 235.2 1 ... ... ... ... 16.12 14.04 12.08 ... ... ... ... 10.42 9.86 9.58 LP642-048 2 23 20 57.7 −01 47 37 0.181 081.5 1 ... ... ... ... 14.79J 12.84J 10.57J 13.64J 12.42J 10.84J 1/ 9.36J 8.79J 8.49J LTT09506 1 23 21 05.7 −16 51 49 0.420 163.0 37 ... ... ... ... 13.85 11.69 10.03 ... ... ... ... 9.17 8.60 8.34 LP934-033 1 23 22 23.6 −27 25 45 0.357 212.6 1 ... ... ... ... 18.75 16.39 13.62 ... ... ... ... 11.64 11.06 10.75 LTT09524 1 23 24 05.6 −05 11 14 0.349 089.0 1 ... ... ... ... 14.49 12.40 10.58 ... ... ... ... 9.56 8.94 8.69 LP822-073 1 23 24 16.9 −15 22 23 0.215 103.1 1 ... ... ... ... 17.96 15.60 12.84 ... ... ... ... 11.19 10.54 10.20 LP822-074 1 23 24 29.1 −18 31 15 0.253 200.8 1 ... ... ... ... 14.50 12.45 10.36 ... ... ... ... 9.54 8.97 8.69 G273-039 1 23 25 16.0 −12 52 31 0.186 100.7 1 ... ... ... ... 12.35 10.39 9.53 ... ... ... ... 8.82 8.11 7.98 L120-120 1 23 25 25.1 −67 40 08 0.284 123.3 1 ... ... ... ... 15.60 13.32 11.09 14.38 13.11 11.48 /71 9.91 9.33 9.05 LHS3954 1 23 27 26.5 −17 41 33 0.562 175.5 1 ... ... ... ... 19.38 16.95 13.71 ... ... ... ... 11.75 11.20 10.84 LP986-059 1 23 27 28.7 −37 54 12 0.323 087.1 1 ... ... ... ... 13.32 10.91 9.62 ... ... ... ... 8.85 8.25 7.98 LP702-096 1 23 27 55.5 −05 27 01 0.201 090.0 1 ... ... ... ... 14.42 12.38 10.66 ... ... ... ... 9.68 9.05 8.78 GJ1284 2 23 30 13.5 −20 23 27 0.374 122.6 1 .06613 .00191 2 18,49 11.89J 9.85J 7.83J 11.14J 10.02J 8.59J /49 7.20J 6.61J 6.33J APM2330-4737 1 23 30 16.2 −47 36 45 1.134 208.7 1 .07271 .00333 1 11 19.17 16.75 13.19 18.08 15.87 13.68 /11 11.23 10.64 10.28 SCR2330-0838 2(1) 23 30 16.9 −08 38 37 0.194 094.1 1 ... ... ... ... 15.47 13.57 11.58 14.29 13.07 11.48 1/ 9.97 9.36 9.13 LEHPM2-2163 1 23 30 38.2 −84 55 19 0.249 254.8 1 ... ... ... ... 15.69 13.52 11.17 ... ... ... ... 9.84 9.31 9.00 DEN2331-2749 1 23 31 21.8 −27 49 50 0.781 001.4 1 .06914 .00206 1 11 20.42 17.99 14.40 19.07 16.54 14.19 /11 11.65 11.06 10.65 LTT09580 1 23 31 25.0 −16 15 58 0.369 138.0 1 ... ... ... ... 13.90 11.78 9.74 13.13 11.95 10.40 3/ 8.88 8.29c 8.00 LTT09582 1 23 32 00.2 −39 17 37 0.261 137.4 1 ... ... ... ... 13.87 11.42 9.91 12.93 11.77 10.30 1/ 8.90 8.26 8.02 LTT09596 1 23 33 36.7 −42 13 22 0.212 189.9 1 ... ... ... ... 13.68 11.28 9.92 12.58 11.48 10.10 2/ 8.68 8.07 7.80 GJ1286 1 23 35 10.5 −02 23 21 1.191 135.1 1 .13830 .00350 1 63 15.56 13.42 10.30 14.73 13.10 11.10 3/ 9.15 8.51 8.18 G275-071 1 23 35 48.8 −24 19 09 0.186 140.0 1 ... ... ... ... 14.68 12.74 10.83 ... ... ... ... 9.65 9.07c 8.77 LHS0547 1 23 36 52.3 −36 28 52 1.225 087.9 1 .08623 .00203 1 29 14.85 12.76 10.54 13.76 12.46 10.79 /29 9.19 8.67 8.42 LP763-003 1 23 37 38.3 −12 50 28 0.384 145.5 1 ... ... ... ... 18.61 15.93 12.92 ... ... ... ... 11.46 10.83 10.45 L026-054 1 23 37 52.8 −76 45 26 0.270 087.9 42 ... ... ... ... 13.06 11.77 8.97 ... ... ... ... 8.58 8.01 7.68 LTT09634 1 23 38 08.2 −16 14 10 0.276 251.7 1 ... ... ... ... 11.52 9.34 7.68 11.34 10.31 9.08 /66 7.81 7.21 7.00

– 62 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LTT09635 1 23 38 17.4 −41 31 04 0.301 135.9 1 .05354 .00352 1 64 12.99 10.56 9.39 11.93 10.89 9.62 /34 8.36 7.73 7.49 LEHPM1-6053 1 23 40 23.9 −40 21 47 0.312 119.9 1 ... ... ... ... 14.23 12.29 10.46 ... ... ... ... 9.26 8.63 8.34 G275-082 1 23 41 16.3 −26 57 21 0.332 087.5 1 ... ... ... ... 13.97 11.74 9.75 ... ... ... ... 9.20 8.50 8.28 LP703-042 1 23 41 39.3 −06 35 50 0.309 111.1 1 ... ... ... ... 16.11 13.99 11.61 ... ... ... ... 10.32 9.70 9.40 LEHPM2-1679 1 23 41 41.6 −85 56 07 0.267 153.2 1 ... ... ... ... 16.59 14.36 12.21 ... ... ... ... 10.60 10.02 9.69 LEHPM1-6134 1 23 44 10.9 −68 31 47 0.328 176.6 1 ... ... ... ... 15.67 13.52 11.49 ... ... ... ... 10.03 9.52 9.16 LEHPM1-6159 1 23 45 10.6 −38 32 24 0.211 181.9 1 ... ... ... ... 15.13 12.96 10.94 ... ... ... ... 9.78 9.16 8.88 LHS4009 2 23 45 31.3 −16 10 20 0.671 217.0 1 .07997 .00137 1 47 15.31J 12.72J 9.93J 14.38J 12.90J 10.99J /47 9.21J 8.61J 8.31J LHS4012 1 23 46 32.0 −50 43 28 0.502 203.7 36 ... ... ... ... 15.75 13.37 11.16 ... ... ... ... 10.05 9.51 9.26 LP987-023 1 23 46 38.2 −34 10 02 0.326 266.4 1 ... ... ... ... 13.67 11.34 9.82 12.58 11.49 10.14 /45 8.85 8.25 8.04 GR0481 1 23 47 37.8 −23 16 06 0.185 113.7 1 ... ... ... ... 15.05 13.21 11.13 ... ... ... ... 9.80 9.14 8.93 LHS4016 2 23 48 36.1 −27 39 39 0.565 244.0 1 .04125 .00155 1 47 13.13J 10.88J 9.30J 12.34J 11.25J 9.90J /49 8.58J 8.02J 7.74J LHS4021 1 23 50 31.6 −09 33 33 0.753 121.5 1 .06241 .00170 1 47 14.01 11.45 9.58 13.44 12.19 10.59 /47 8.94 8.39c 8.04 LEHPM1-6333 2 23 51 50.5 −25 37 37 0.408 067.3 1 ... ... ... ... 22.05J 18.89J 15.57J 19.98J 17.86J 15.47J 2/ 12.47J 11.73J 11.27J LEHPM1-6366 1 23 52 32.2 −34 13 07 0.199 134.0 1 ... ... ... ... 17.87 15.65 13.18 ... ... ... ... 11.31 10.72 10.42 L217-036 1 23 52 44.4 −57 56 03 0.320 080.6 1 ... ... ... ... 14.42 12.22 10.26 ... ... ... ... 9.25 8.59c 8.30 LTT09783 1 23 53 08.3 −42 32 04 0.223 065.2 1 ... ... ... ... 13.72 11.60 9.77 ... ... ... ... 9.17 8.59 8.34 L085-031 1 23 53 25.2 −70 56 41 0.292 089.4 1 ... ... ... ... 14.32 11.96 9.80 13.01 11.78 10.18 3/ 8.68 8.10 7.78 LP987-047 1 23 53 41.0 −35 59 06 0.299 059.3 1 ... ... ... ... 14.77 12.69 10.68 ... ... ... ... 9.41 8.78 8.55 L026-027 1 23 53 50.1 −75 37 57 0.452 147.1 28 .10007 .00105 1 64 10.80 8.27 6.94 10.02 8.99 7.72 /34 6.45 5.78 5.55 LHS4038 1 23 54 04.3 −41 32 31 0.550 110.6 1 ... ... ... ... 14.68 12.55 10.63 ... ... ... ... 9.50 8.93 8.67 L169-058 1 23 54 41.3 −61 35 10 0.356 124.0 1 ... ... ... ... 14.16 11.74 9.93 ... ... ... ... 9.19 8.62 8.35 LHS4046 1 23 55 26.0 −03 59 00 0.520 088.2 36 ... ... ... ... 14.77 12.94 10.77 13.86 12.72 11.25 /69 9.87 9.21 8.95 GJ0912 1 23 55 39.8 −06 08 33 0.615 231.3 28 .05464 .00276 2 63,64 11.80 9.98 7.99 11.16 10.13 8.87 /5 7.60 6.96 6.72 G158-008 1 23 55 55.2 −13 21 24 0.314 089.4 1 ... ... ... ... 14.24 12.11 10.36 13.43 12.26 10.72 /45 9.26 8.70 8.43 LEHPM1-6494 1 23 56 10.8 −34 26 05 0.319 163.6 1 .05237 .00171 1 16 22.21 19.31 16.15 20.83 18.36 15.91 /16 12.95 12.38 11.97 SCR2356-0429 2 23 56 20.4 −04 29 32 0.230 100.9 1 ... ... ... ... 14.74J 12.75J 10.54J 13.70J 12.54J 11.04J 1/ 9.64 9.04 8.78 LP987-060 1 23 57 53.6 −34 07 36 0.408 156.0 1 ... ... ... ... 14.36 12.03 10.36 ... ... ... ... 9.28 8.62 8.36 LP764-040 3(1) 23 58 13.7 −17 24 34 0.239 084.9 1 ... ... ... ... 13.24 11.36 9.38 11.88 11.00 10.09 2/ 8.31 7.70 7.44 APM2359-6246 1 23 58 42.9 −62 45 42 0.606 083.6 1 .04798 .00222 1 11 18.17 15.88 13.08 16.95 15.26 13.30 /11 11.39 10.83 10.52 LTT09828 2 23 59 44.8 −44 05 00 0.255 358.0 1 ... ... ... ... 13.90J 11.79J 9.70J 12.81J 11.67J 10.23J 3/ 8.88J 8.29J 8.04J LHS4058 1 23 59 51.4 −34 06 43 0.939 132.8 47 .06314 .00202 1 47 14.07 11.89 9.81 12.84 11.64 10.08 /47 8.59 7.98 7.75

GJ1293 1 00 01 25.8 −16 56 55 0.386 132.8 1 .03113 .00221 1 64 11.48 9.08 8.46 10.73 9.88 9.04 2/ 8.02 7.41 7.22 L290-032 1 00 02 27.1 −46 01 44 0.212 096.9 1 .02606 .00435 1 64 13.47 11.44 9.90 ... ... ... ... 9.18 8.52 8.34 LHS0105 1 00 09 17.3 −19 42 32 1.180 059.6 1 ... ... ... ... 16.88 14.88 12.53 15.52 14.18 12.46 1/ 10.88 10.33 10.07 LTT00074 1 00 11 04.6 −05 47 02 0.276 089.1 1 .03878 .00209 2 63,64 11.48 9.61 8.21 10.86 9.96 9.04 /68 7.98 7.31 7.12 LTT00095 1 00 13 29.1 −36 49 44 0.349 211.6 1 .03548 .00230 1 64 12.26 9.69 8.47 ... ... ... ... 7.80 7.18 6.96 LHS1048 1 00 15 33.5 −35 11 48 0.927 095.1 1 ... ... ... ... 15.77 13.80 12.10 14.53 13.47 12.09 2/ 10.80 10.26 10.06 SCR0015-6957 1 00 15 52.5 −69 57 21 0.301 108.5 1 ... ... ... ... 14.58 12.54 10.91 13.54 12.52 11.18 1/ 9.89 9.24 9.01 LHS0109 1 00 17 40.0 −10 46 17 1.051 180.0 1 .02840 .00350 1 63 15.03 12.93 12.00 13.88 12.97 12.10 2/ 11.05 10.56 10.37 LEHPM1-0439 1 00 18 19.4 −82 07 15 0.880 091.3 42 ... ... ... ... 16.92 14.76 12.62 15.78 14.63 13.03 1/ 11.68 11.12 10.86 L086-093 1 00 18 34.6 −68 46 60 0.297 214.6 1 ... ... ... ... 12.33 10.05 9.21 11.32 10.43 9.57 /46 8.58 7.97 7.72 LP644-095 1 00 19 12.4 −03 03 13 0.237 183.6 1 .03231 .00226 1 64 12.05 10.06 8.72 ... ... ... ... 8.27 7.65 7.46 LHS0110 2 00 19 37.0 −28 09 46 1.388 192.2 1 .03375a .00120 2 30,30 13.39J 11.37J 10.25J 13.65 12.66 11.44 /30 10.25 9.73 9.48 LEHPM1-0494 2(1) 00 21 05.9 −42 44 43 0.253 086.5 16 .03842a .00144 2 16,16 18.56 16.18 13.60 17.28 15.67 13.69 /16 12.00 11.37 11.05 LTT00207 1 00 23 47.3 −36 51 41 0.187 252.2 1 .02489 .00159 1 64 11.87 9.78 9.39 ... ... ... ... 8.27 7.61 7.47 LHS1094 1 00 32 15.4 −63 05 28 0.525 103.2 1 .03988 .00109 2 63,64 10.87 9.01 7.43 ... ... ... ... 7.02 6.34 6.17

– 63 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

SCR0033-6317 1 00 33 02.3 −63 17 50 0.341 072.9 1 ... ... ... ... 15.68 13.79 11.93 14.79 13.62 12.02 1/ 10.41 9.80 9.57 LHS1106 1 00 36 00.0 −09 30 56 0.577 195.4 1 .02960 .00206 1 64 12.33 10.13 9.27 11.25 10.40 9.60 /69 8.54 7.90 7.72 SCR0052-6155 1 00 52 09.9 −61 55 23 0.220 087.0 1 ... ... ... ... 14.82 12.63 10.86 13.69 12.60 11.26 1/ 9.98 9.35 9.12 SIP0052-6201 1 00 52 15.3 −62 01 55 1.123 082.8 14 ... ... ... ... 19.63 17.36 14.18 18.41 16.46 14.26 2/ 12.15 11.74 11.37 GJ0043 1 00 55 25.4 −51 49 58 0.432 045.0 1 .03031 .00394 2 63,64 13.04 11.15 9.21 12.34 11.34 10.16 /5 8.99 8.39 8.11 LTT00525 1 00 55 49.3 −29 40 34 0.400 074.5 1 .03281 .00113 2 63,64 11.09 9.19 8.09 ... ... ... ... 7.28 6.74 6.57 G270-100 1 00 56 30.2 −04 25 16 0.370 109.9 1 .03330 .00380 1 63 16.06 13.91 11.81 ... ... ... ... 10.44 9.83 9.56 LTT00648 1 01 09 38.8 −07 10 50 0.430 214.3 28 .02655 .00287 1 64 12.19 9.88 8.86 11.38 10.38 9.20 /33 7.96 7.38 7.11 SCR0112-7939 1 01 12 23.5 −79 39 13 0.323 066.3 1 ... ... ... ... 17.16 15.14 12.89 15.75 14.48 12.79 1/ 11.18 10.62 10.34 GJ0056.2 1 01 17 59.4 −48 09 01 0.244 067.0 1 .02907 .00275 2 63,64 12.72 10.35 9.64 11.54 10.65 9.74 /5 8.68 8.00 7.84 LHS1245 1 01 24 22.1 −44 08 11 0.447 220.2 1 .02949 .00401 1 64 13.30 10.76 9.88 ... ... ... ... 8.93 8.30 8.09 GJ2022 3(2) 01 24 27.7 −33 55 09 0.215 130.1 1 .03880 .00213 1 49 14.63J 12.65J 10.70J 13.56J 12.26J 10.62J /49 9.20J 8.66J 8.24J GJ1038 1 01 25 01.8 −32 51 04 0.241 056.4 1 .03977 .00160 1 64 11.08 8.69 8.21 ... ... ... ... 7.07 6.42 6.21 L222-009 1 01 35 40.4 −50 15 42 0.230 078.2 1 .02073 .00243 1 64 11.53 9.23 8.37 ... ... ... ... 7.93 7.27 7.14 LP939-103 1 01 36 36.9 −34 23 26 0.209 069.7 1 ... ... ... ... 15.40 14.66 12.65 15.49 14.37 12.88 1/ 11.47 10.92 10.64 SCR0138-5353 1 01 38 20.5 −53 53 26 0.297 071.1 1 ... ... ... ... 15.70 13.70 11.74 14.36 13.20 11.70 /71 10.28 9.69 9.42 SCR0138-7855 2 01 38 54.0 −78 55 18 0.201 075.4 1 ... ... ... ... 14.87J 12.78J 11.20J 13.54J 12.49J 11.19J 1/ 9.92J 9.35J 9.11J SCR0139-7536 1 01 39 27.9 −75 36 14 0.279 060.8 1 ... ... ... ... 15.57 13.17 11.51 13.79 12.66 11.23 1/ 9.87 9.24 8.97 LP708-253 1 01 40 04.8 −13 54 41 0.217 173.9 28 .02865 .00374 1 64 13.31 11.38 9.94 ... ... ... ... 8.78 8.09 7.93 L367-082 1 01 41 03.6 −43 38 10 0.221 190.5 1 .02395 .00261 1 64 12.45 10.41 9.53 ... ... ... ... 8.81 8.14 7.96 LHS1288 1 01 42 55.8 −42 12 13 0.685 098.3 1 .03518 .00127 2 63,64 12.45 10.38 9.16 11.19 10.27 9.27 1/ 8.24 7.62c 7.40 SCR0143-3840 1 01 43 03.3 −38 40 08 0.188 101.2 1 ... ... ... ... 12.71 10.51 9.22 11.55 10.60 9.59 2/ 8.52 7.85 7.68 L367-008 1 01 45 21.4 −39 57 20 0.316 067.1 1 .03384 .00230 1 64 12.49 10.28 9.14 ... ... ... ... 8.43 7.76 7.59 L173-003 1 01 51 46.2 −54 57 58 0.283 092.8 1 .02089 .00335 1 64 12.64 10.75 9.61 ... ... ... ... 9.01 8.17 7.94 SCR0153-0703 1 01 53 20.6 −07 03 32 0.183 142.7 1 ... ... ... ... 15.66 13.39 11.76 14.42 13.22 11.72 1/ 10.31 9.71 9.44 SCR0153-5000 1 01 53 24.2 −50 00 04 0.182 025.4 1 ... ... ... ... 14.78 12.45 10.95 13.41 12.38 11.11 1/ 9.93 9.30 9.03 L223-102 1 01 54 39.0 −50 45 58 0.523 114.9 1 ... ... ... ... 15.54 13.39 11.79 14.16 13.19 11.98 1/ 10.77 10.31 10.06 LTT01021 1 01 55 32.2 −15 31 22 0.275 136.5 1 ... ... ... ... 12.40 9.57 9.10 11.71 10.80 9.85 /46 8.81 8.17c 7.94 SCR0156-6702 2(1) 01 56 26.1 −67 02 36 0.183 057.5 1 ... ... ... ... 13.55 11.37 10.22 12.72 11.77 10.61 1/ 9.44 8.75 8.59 SCR0201-5739 1 02 01 38.8 −57 39 36 0.202 075.4 1 ... ... ... ... 14.98 13.05 11.49 13.56 12.54 11.35 1/ 10.14 9.47 9.25 L583-033 2 02 02 17.5 −26 33 52 0.336 146.0 37 ... ... ... ... 14.30J 11.83J 9.80J 13.45J 12.24J 10.69J 2/ 9.81c 9.22c 8.95 LP649-030 1 02 03 30.2 −04 54 41 0.210 150.4 1 .03474 .00259 1 64 11.81 9.63 8.79 11.12 10.23 9.32 /68 8.20 7.54 7.36 GJ0088 1 02 12 51.0 −17 41 12 0.548 067.0 1 .03773 .00264 2 63,64 11.30 9.29 8.25 11.08 10.16 9.24 /5 8.20 7.60c 7.34 LP941-016 1 02 13 37.4 −35 12 24 0.424 199.4 1 .03450 .00355 1 64 12.94 10.34 9.69 ... ... ... ... 8.75 8.10 7.85 LHS1380 1 02 17 56.8 −35 37 01 0.553 057.6 1 .03494 .00275 1 64 12.42 10.08 8.88 11.63 10.67 9.62 /44 8.51 7.93 7.68 LHS1386 1 02 18 41.4 −39 37 11 0.540 082.0 1 ... ... ... ... 14.22 11.98 10.27 13.33 12.27 10.93 1/ 9.67 9.07 8.80 SCR0228-6248 1 02 28 13.9 −62 48 05 0.228 060.8 1 ... ... ... ... 15.84 13.53 11.28 14.83 13.57 11.94 1/ 10.43 9.86 9.57 SCR0232-3006 1 02 32 03.1 −30 06 41 0.240 158.8 1 ... ... ... ... 15.95 13.32 11.78 14.78 13.59 12.05 1/ 10.57 9.93 9.65 SCR0234-8204 1 02 34 47.1 −82 04 29 0.618 333.3 60 ... ... ... ... ... 14.13 12.81 14.97 13.87 12.46 1/ 11.11 10.51 10.25 LHS5058 1 02 36 32.8 −34 36 32 0.530 136.0 1 .03186 .00318 1 64 12.47 10.33 9.18 ... ... ... ... 8.67 8.02 7.84 SCR0238-1420 1 02 38 07.5 −14 20 11 0.275 157.9 1 ... ... ... ... 12.99 11.41 9.75 12.36 11.38 10.22 2/ 9.05 8.39 8.16 L441-032 1 02 39 56.7 −38 28 00 0.388 035.5 1 .02911 .00231 1 64 12.31 10.27 9.21 ... ... ... ... 8.47 7.82 7.63 LHS0158 1 02 42 02.9 −44 30 59 1.005 087.6 29 .02494 .00161 1 29 14.15 11.82 10.46 13.64 12.66 11.60 /29 10.43 9.94 9.73 LP651-009 1 02 46 12.9 −04 19 57 0.207 072.1 1 ... ... ... ... 16.06 13.82 11.97 15.06 13.88 12.37 2/ 10.91 10.37 10.08 LP651-011 1 02 46 48.9 −04 21 28 0.206 063.3 1 ... ... ... ... 14.24 12.22 10.70 13.48 12.46 11.26 2/ 10.05 9.48 9.23 SCR0247-5729 2 02 47 14.6 −57 29 22 0.211 186.6 1 ... ... ... ... 16.80J 14.56J 12.43J 15.65J 14.36J 12.73J 2/ 11.20J 10.62J 10.36J LHS1459 1 02 51 43.3 −26 01 39 0.819 179.8 1 ... ... ... ... 14.83 12.79 11.23 13.88 12.91 11.83 1/ 10.70 10.17 9.95 LTT01393 1 02 55 23.2 −25 13 29 0.343 102.2 1 .03449 .00345 1 64 11.94 10.13 8.20 ... ... ... ... 8.08 7.45 7.23 L012-040 1 03 03 26.4 −82 50 39 0.434 056.0 1 .02725 .00129 1 64 12.05 10.11 9.29 ... ... ... ... 8.37 7.75 7.59

– 64 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LTT01453 1 03 03 36.7 −25 35 33 0.251 060.3 1 .02592 .00256 1 64 11.68 9.71 8.14 11.04 10.11 9.13 /44 8.00 7.34 7.11 LTT01552 1 03 17 28.2 −01 07 27 0.308 184.5 1 ... ... ... ... 13.79 11.61 10.53 12.85 11.89 10.87 2/ 9.73 9.18 8.99 LP887-068 1 03 17 35.1 −27 41 47 0.329 099.8 1 .03395 .00261 1 64 12.39 10.30 9.00 ... ... ... ... 8.36 7.70c 7.46 G077-042 1 03 17 55.4 −01 05 41 0.301 184.7 1 ... ... ... ... 15.48 13.43 11.64 14.45 13.36 12.08 2/ 10.81 10.26 9.97 LP888-006 1 03 20 51.1 −28 15 34 0.186 063.3 1 ... ... ... ... 12.80 10.66 8.96 12.19 11.21 10.07 /44 8.94 8.29 8.04 SCR0325-0308 1 03 25 03.1 −03 08 20 0.195 087.9 1 ... ... ... ... 15.22 13.17 11.39 13.88 12.79 11.41 /71 10.06 9.45 9.20 LHS1561 1 03 34 39.6 −04 50 33 0.543 129.5 1 .03420 .00172 1 47 13.63 11.43 9.47 13.07 11.84 10.30 /47 8.83 8.27 7.93 SCR0337-1056 1 03 37 38.2 −10 56 55 0.180 088.3 1 ... ... ... ... 11.81 9.68 8.44 11.34 10.45 9.45 2/ 8.41 7.80 7.59 GJ0155.3 1 03 53 19.7 −37 03 59 1.179 195.9 1 .03985 .00283 2 63,64 13.06 11.08 9.63 ... ... ... ... 8.74 8.21 7.95 LHS1622 1 04 03 30.4 −37 53 33 0.690 051.7 1 ... ... ... ... 16.01 13.86 11.99 14.73 13.51 11.96 1/ 10.43 9.87 9.58 LHS0186 1 04 03 38.4 −05 08 05 1.153 168.0 1 .01940 .00430 1 63 16.24 14.31 12.76 14.87 13.86 12.73 2/ 11.57 11.10 10.85 WT0135 1 04 11 27.1 −44 18 10 0.692 067.1 30 .03904 .00242 1 30 15.04 12.65 11.03 14.10 13.06 11.82 /30 10.55 10.11 9.83 LHS1656 1 04 18 51.0 −57 14 01 0.815 022.1 47 .03941 .00194 1 47 14.07 12.02 10.03 13.29 12.18 10.84 /47 9.52 8.94 8.65 L446-008 1 04 21 00.5 −35 51 21 0.246 090.0 28 .03445 .00159 1 64 11.57 8.73 8.43 10.63 9.78 8.94 2/ 7.92 7.32 7.11 LHS1676 1 04 31 44.0 −21 50 44 0.852 147.2 1 ... ... ... ... 17.31 15.14 12.42 16.02 14.57 12.75 2/ 11.02 10.55 10.28 LHS1678 1 04 32 42.6 −39 47 12 0.997 165.9 36 ... ... ... ... 13.44 10.90 9.69 12.48 11.46 10.26 3/ 9.02 8.50 8.26 SCR0457-0731 1 04 57 23.8 −07 31 40 0.243 133.0 1 ... ... ... ... 14.23 12.15 10.30 13.58 12.45 11.05 1/ 9.68 9.07 8.82 L305-024 1 05 06 07.3 −47 12 52 0.207 319.4 1 ... ... ... ... 14.07 11.96 10.32 12.63 11.65 10.46 /71 9.32 8.66c 8.43 LP892-040 1 05 21 15.9 −32 21 27 0.215 121.1 1 ... ... ... ... 15.51 13.17 11.13 14.24 13.10 11.57 /45 10.08 9.49 9.21 SCR0525-7425 1 05 25 45.6 −74 25 26 0.417 040.2 1 ... ... ... ... 14.81 12.89 11.35 13.43 12.44 11.21 1/ 10.03 9.42 9.21 SCR0527-7231 1 05 27 07.0 −72 31 20 0.368 018.4 1 ... ... ... ... 16.01 13.97 11.77 14.71 13.49 11.86 /71 10.34 9.76 9.47 LHS1815 1 06 04 20.4 −55 18 47 0.741 064.6 1 .03545 .00257 2 63,64 13.27 11.06 9.61 ... ... ... ... 8.80 8.21 7.99 SCR0610-1832 1 06 10 08.2 −18 32 25 0.209 137.6 1 ... ... ... ... 15.98 13.81 11.58 14.87 13.68 12.12 1/ 10.64 10.05 9.76 LHS1837 1 06 19 50.7 −59 52 25 0.599 162.0 1 ... ... ... ... 14.75 12.55 10.86 13.73 12.69 11.48 1/ 10.25 9.67 9.45 SCR0629-4648 2(1) 06 29 33.6 −46 48 37 0.219 066.9 1 ... ... ... ... 14.39 11.98 10.38 13.31 12.20 10.86 1/ 9.59 8.98 8.72 SCR0635-6722 1 06 35 48.8 −67 22 59 0.383 340.0 1 ... ... ... ... 12.21 9.84 8.67 11.54 10.62 9.64 /71 8.54 7.96 7.69 SCR0639-6939 1 06 39 08.4 −69 39 32 0.251 021.2 1 ... ... ... ... 14.60 12.40 10.59 13.61 12.56 11.32 2/ 10.09 9.49 9.25 SCR0639-6934 1 06 39 22.3 −69 34 13 0.258 023.6 1 ... ... ... ... 13.68 11.25 10.11 12.71 11.74 10.69 2/ 9.55 8.94 8.73 LP453-049 1 06 44 32.4 −38 31 59 0.273 093.5 1 ... ... ... ... 15.58 13.25 11.11 14.18 13.04 11.54 /46 10.09 9.47 9.20 SCR0659-2031 1 06 59 48.7 −20 31 47 0.305 169.9 1 ... ... ... ... 13.95 11.56 9.64 13.00 11.98 10.72 1/ 9.51 8.93 8.68 LHS1904 1 07 11 19.7 −67 07 22 0.649 172.7 1 .03788 .00139 2 63,64 11.95 9.80 8.90 11.15 10.23 9.30 /32 8.28 7.64 7.41 SCR0714-7140 1 07 14 26.2 −71 40 38 0.194 335.7 1 ... ... ... ... 17.83 15.82 13.34 16.79 15.32 13.50 1/ 11.72 11.09 10.77 SCR0719-5050 1 07 19 35.4 −50 50 52 0.216 107.4 1 ... ... ... ... 16.00 13.74 10.88 14.59 13.35 11.80 1/ 10.33 9.74 9.48 SCR0725-8530 1 07 25 22.2 −85 30 58 0.600 193.6 1 ... ... ... ... 15.44 13.03 11.26 14.30 13.21 11.84 1/ 10.54 10.02 9.70 LTT02856 1 07 26 29.1 −70 49 41 0.393 323.2 1 ... ... ... ... 13.73 11.30 9.70 12.59 11.52 10.30 /9 9.09 8.47 8.24 WT0214 1 07 28 40.1 −61 20 41 0.618 316.0 1 ... ... ... ... 17.36 15.33 12.83 16.00 14.74 13.10 1/ 11.61 11.11 10.86 GJ2061 1 07 31 04.1 −37 13 46 0.289 186.5 1 .03003 .00408 1 64 12.39 10.01 9.05 11.47 10.49 9.40 /33 8.25 7.65 7.44 SCR0743-1929 1 07 43 22.1 −19 29 04 0.226 213.0 1 ... ... ... ... 15.81 13.24 10.61 14.41 13.25 11.74 1/ 10.26 9.71 9.45 SCR0745-4814 2(1) 07 45 32.2 −48 14 57 0.200 174.9 1 ... ... ... ... 18.00 15.80 13.14 16.62 15.16 13.32 1/ 11.57 11.03 10.74 GJ1100 1 07 47 03.1 −13 56 19 0.513 166.3 28 .03623 .00259 2 63,64 12.40 9.91 8.67 11.51 10.61 9.66 /70 8.53 7.94 7.73 SCR0749-4955 1 07 49 29.4 −49 55 06 0.257 150.9 1 ... ... ... ... 16.64 14.74 12.34 15.28 14.03 12.44 1/ 10.93 10.25 9.96 SCR0758-4126 1 07 58 28.7 −41 26 44 0.185 261.9 1 ... ... ... ... 14.59 12.28 10.11 13.44 12.36 11.01 1/ 9.69 9.13 8.91 LP784-012 1 08 02 03.4 −17 10 18 0.387 294.2 1 .03331 .00316 1 64 12.00 8.91 9.08 ... ... ... ... 8.18 7.60 7.35 SCR0810-4056 1 08 10 20.3 −40 56 50 0.243 169.5 1 ... ... ... ... 13.35 11.14 9.83 12.44 11.48 10.41 1/ 9.30 8.66 8.45 SCR0829-6203 1 08 29 24.7 −62 03 23 0.595 299.5 1 ... ... ... ... 17.78 15.72 13.42 16.22 14.95 13.24 1/ 11.70 11.21 10.92 L891-016 2(1) 08 31 21.6 −06 02 02 0.455 260.4 1 .03795 .00270 1 64 11.78 9.49 8.11 11.21 10.29 9.21 /67 8.00 7.37 7.18 L186-042 1 08 35 47.5 −56 45 13 0.393 128.7 1 ... ... ... ... 13.23 10.01 9.58 11.78 10.88 9.99 /46 8.97 8.34 8.16 LTT03187 1 08 36 14.3 −41 33 26 0.234 293.3 1 .02567 .00203 2 63,64 11.74 9.46 7.37 ... ... ... ... 8.08 7.34c 7.02 GJ0316 1 08 40 00.3 −06 28 33 0.213 153.1 1 .03322 .00157 2 63,64 10.87 8.92 8.23 9.97 9.11 8.25 /5 7.20 6.57 6.38

– 65 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

SCR0840-3113 1 08 40 56.6 −31 13 33 0.226 160.0 1 ... ... ... ... 15.57 13.32 11.35 14.34 13.12 11.59 1/ 10.06 9.54 9.27 L098-062 1 08 41 32.6 −68 25 40 0.191 327.4 1 .03244 .00145 1 64 11.87 9.80 9.40 11.05 10.18 9.29 1/ 8.23 7.58c 7.38 SCR0843-2937 1 08 43 09.5 −29 37 31 0.514 145.1 1 ... ... ... ... 16.13 13.95 11.68 14.93 13.66 12.06 1/ 10.53 10.01 9.72 SCR0844-7120 1 08 44 54.6 −71 20 43 0.201 311.4 1 ... ... ... ... 15.11 13.08 11.04 14.07 12.96 11.56 1/ 10.25 9.57 9.30 SCR0852-3507 1 08 52 54.1 −35 07 33 0.346 272.3 1 ... ... ... ... 14.89 12.79 10.17 13.79 12.64 11.17 1/ 9.77 9.19 8.94 SCR0853-6123 1 08 53 03.0 −61 23 48 0.466 138.4 1 ... ... ... ... 17.94 15.73 12.96 16.75 15.31 13.52 1/ 11.82 11.27 10.91 LHS2072 1 08 55 04.7 −71 35 48 0.531 338.2 1 ... ... ... ... 15.65 13.36 11.24 14.46 13.22 11.65 1/ 10.17 9.59 9.34 LP786-022 1 08 57 14.2 −19 35 04 0.326 190.1 1 .03535 .00240 1 64 12.69 10.72 9.54 ... ... ... ... 8.69 8.05 7.86 SCR0859-7517 1 08 59 52.0 −75 17 30 0.291 330.7 1 ... ... ... ... 14.64 12.66 10.96 13.58 12.50 11.15 1/ 9.86 9.24 9.03 SCR0904-4851 1 09 04 47.8 −48 51 24 0.184 313.7 1 ... ... ... ... 17.58 15.80 13.54 16.18 14.83 13.13 1/ 11.49 10.94 10.60 SCR0912-8311 1 09 12 59.6 −83 11 52 0.802 332.3 1 ... ... ... ... 17.99 15.74 13.19 16.66 15.20 13.37 1/ 11.56 10.98 10.69 SCR0914-7304 1 09 14 53.9 −73 04 19 0.182 319.4 1 ... ... ... ... 16.00 13.84 11.87 14.68 13.49 11.95 1/ 10.50 9.87 9.61 SCR0916-3431 1 09 16 07.1 −34 31 31 0.378 347.5 1 ... ... ... ... 16.29 14.22 11.81 15.04 13.82 12.23 1/ 10.71 10.11 9.81 SIP0933-1602 1 09 33 49.7 −16 02 55 1.357 188.3 14 ... ... ... ... 20.17 18.01 15.31 19.11 17.11 14.78 2/ 12.72 12.23 11.89 SCR0936-3237 1 09 36 01.5 −32 37 59 0.207 182.9 1 ... ... ... ... 13.02 10.69 9.19 12.19 11.19 10.09 1/ 8.95 8.34 8.12 CE089 1 09 38 53.8 −33 48 45 1.330 283.9 50 ... ... ... ... 17.97 15.85 13.13 16.87 15.34 13.38 1/ 11.51 11.05 10.78 SCR0943-4833 1 09 43 18.2 −48 33 50 0.215 285.5 1 ... ... ... ... 15.31 13.27 11.30 14.30 13.14 11.63 1/ 10.18 9.56 9.27 L462-023 1 09 44 45.4 −36 32 38 0.282 238.2 1 .02513 .00221 1 64 12.39 10.27 9.27 ... ... ... ... 8.61 7.94 7.79 SCR0947-0020 1 09 47 20.1 −00 20 09 0.217 283.4 8 ... ... ... ... 19.44 17.26 14.47 18.23 16.50 14.32 1/ 12.26 11.63 11.35 LHS2209 1 09 54 52.5 −13 31 21 0.728 211.4 1 ... ... ... ... 15.54 13.53 11.95 14.46 13.48 12.41 1/ 11.25 10.69 10.47 SCR1005-4322 1 10 05 03.1 −43 22 28 0.682 294.1 1 ... ... ... ... 14.76 12.51 ... 13.76 12.65 11.20 1/ 9.85 9.33 9.06 WT0248 1 10 05 54.9 −67 21 31 1.212 265.2 29 .03844 .00283 1 29 14.67 13.28 12.02 14.52 13.40 11.95 /29 10.56 10.10 9.87 LTT03719 1 10 10 00.0 −25 58 33 0.318 146.2 1 .02660 .00193 1 64 12.02 10.13 9.15 ... ... ... ... 8.32 7.67c 7.50 LHS2228 1 10 11 09.2 −82 51 58 0.576 305.6 1 .03577 .00147 1 64 11.90 9.75 8.87 ... ... ... ... 8.21 7.55 7.37 SCR1011-8106 1 10 11 12.4 −81 06 42 0.474 112.2 1 ... ... ... ... 16.54 14.50 12.53 15.20 13.94 12.37 1/ 10.82 10.24 9.93 LTT03763 1 10 15 50.1 −11 47 48 0.302 255.8 1 .02597 .00345 1 64 12.66 10.42 9.62 ... ... ... ... 8.69 8.05c 7.81 L752-053 1 10 21 08.1 −17 43 38 0.448 281.2 1 .03018 .00239 1 64 11.58 9.39 8.13 11.25 10.32 9.36 /44 8.26 7.59 7.40 LHS2257 1 10 24 23.4 −02 34 18 0.886 273.8 36 ... ... ... ... ... ... ... 14.89 14.39 13.89 1/ 10.86 10.37 10.08 LHS0284 1 10 36 03.1 −14 42 29 1.165 300.5 1 .02114 .00130 1 30 17.75 15.75 13.64 16.78 15.49 13.81 /30 12.28 11.79 11.58 LP904-036 1 10 36 28.4 −28 27 15 0.191 258.0 1 .03962 .00311 1 64 13.23 11.07 9.60 12.02 10.99 9.74 1/ 8.50 7.83c 7.58 LP904-045 1 10 40 18.5 −29 30 23 0.205 259.8 1 .02656 .00229 1 64 13.13 10.82 9.76 ... ... ... ... 8.78 8.07c 7.89 L017-050 1 10 41 56.4 −82 59 23 0.375 090.7 1 ... ... ... ... 14.78 12.41 10.95 13.21 12.12 10.77 1/ 9.51 8.92 8.66 LP905-022 1 10 51 58.9 −32 01 20 0.236 282.3 1 .03086 .00268 1 64 12.91 10.63 9.49 ... ... ... ... 8.42 7.78 7.60 LP849-020 1 10 52 26.4 −22 41 16 0.184 131.2 1 .03492 .00336 1 64 12.67 10.66 9.32 ... ... ... ... 8.86 8.23 7.96 LTT04033 1 10 58 41.3 −42 40 09 0.252 292.5 1 .01927 .00343 2 63,64 12.64 10.76 10.28 ... ... ... ... 8.89 8.26 8.16 LTT04042 1 11 00 02.8 −35 06 37 0.259 147.1 1 .02955 .00437 1 64 12.03 9.91 8.47 ... ... ... ... 8.08 7.44 7.24 SCR1104-0150 1 11 04 08.4 −01 50 18 0.204 270.7 1 ... ... ... ... 14.38 12.52 11.10 13.29 12.29 11.11 1/ 9.87 9.30 9.04 SCR1104-8352 1 11 04 51.0 −83 52 25 0.438 256.7 1 ... ... ... ... 15.50 13.47 12.23 13.89 12.92 11.67 1/ 10.53 9.96 9.67 UPM1105-5825 2(1) 11 05 30.4 −58 25 19 0.184 286.3 20 ... ... ... ... 14.44 ... 11.60 13.95 12.88 11.57 1/ 10.30 9.71 9.50 LTT04105 1 11 09 12.2 −04 36 25 0.347 251.1 1 .03506 .00235 1 64 11.76 10.13 8.55 ... ... ... ... 8.20 7.60 7.33 LHS0299 1 11 11 22.7 −06 31 56 1.073 206.9 1 .01200 .00290 1 63 15.51 13.38 12.16 14.78 13.85 12.94 1/ 11.92 11.37 11.14 LP792-044 3(1) 11 13 13.0 −19 06 23 0.221 292.6 1 ... ... ... ... 15.98 13.97 12.11 15.05 13.92 12.43 3/ 11.20 10.66 10.46 SCR1117-3202 1 11 17 29.3 −32 02 10 0.447 204.8 1 ... ... ... ... 16.00 13.58 11.33 14.58 13.37 11.80 1/ 10.34 9.76 9.48 SCR1118-3511 1 11 18 59.7 −35 11 39 0.199 205.6 1 ... ... ... ... 17.17 14.90 12.81 15.93 14.56 12.83 1/ 11.15 10.50 10.23 SCR1121-8057 1 11 21 27.9 −80 57 03 0.244 291.6 1 ... ... ... ... 15.26 13.71 11.50 14.54 13.38 11.90 1/ 10.48 9.84 9.60 GJ0429.2 1 11 28 00.5 −09 10 57 1.007 147.8 28 .03979 .00299 2 63,64 12.77 10.90 9.39 12.37 11.43 10.38 1/ 9.29 8.74c 8.49 SCR1132-8446 1 11 32 22.3 −84 46 28 0.638 280.0 1 ... ... ... ... 17.64 15.87 13.94 16.27 15.12 13.58 1/ 12.22 11.76 11.51 USN1137-0317 1 11 37 16.6 −03 17 37 1.128 226.1 1 ... ... ... ... 16.41 14.24 12.02 15.65 14.27 12.50 2/ 10.87 10.36 10.09 CE440-087 1 11 47 50.7 −28 49 45 0.430 239.0 51 ... ... ... ... ... ... ... 16.21 14.98 13.38 2/ 12.02 11.45 11.24

– 66 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

Ruiz440-064 1 11 48 50.6 −28 33 23 0.673 261.8 10 .02511 .00149 1 10 ... ... 12.84 16.24 14.79 12.92 2/ 11.13 10.64 10.35 SCR1153-5430 1 11 53 22.6 −54 30 08 0.303 255.8 1 ... ... ... ... 15.39 13.16 11.01 14.30 13.39 11.61 1/ 10.21 9.58 9.28 SCR1159-4256 1 11 59 37.7 −42 56 39 0.607 223.0 1 ... ... ... ... 14.20 11.96 10.35 13.35 12.22 10.85 1/ 9.54 8.98c 8.72 LP907-063 1 12 03 03.9 −33 39 55 0.401 263.3 1 ... ... ... ... 18.61 16.54 14.06 17.79 16.15 14.22 1/ 12.39 11.83 11.50 SCR1204-4037 1 12 04 15.5 −40 37 53 0.702 151.4 1 ... ... ... ... 14.70 12.61 10.72 13.47 12.34 10.92 /71 9.57 9.02 8.75 GJ2090 1 12 04 36.6 −38 16 25 0.711 108.1 1 .03634 .00276 1 64 12.96 10.71 9.56 ... ... ... ... 8.60 7.99 7.73 WT1928 1 12 08 06.9 −32 06 36 0.381 258.0 74 ... ... ... ... 15.61 13.77 12.05 14.04 12.96 11.62 2/ 10.30 9.66 9.40 NLTT30217 1 12 17 06.8 −17 38 15 0.327 253.2 1 ... ... ... ... 12.78 10.83 9.66 11.98 11.03 9.99 /44 8.86 8.23 8.03 LHS0323 1 12 17 30.2 −29 02 21 1.106 267.1 30 .02329 .00183 1 30 17.94 16.06 13.99 16.95 15.66 14.02 /30 12.54 12.05 11.78 LP470-065 2 12 17 46.8 −39 04 05 0.243 204.0 1 .03238 .00260 1 64 12.12J 9.98J 9.13J ... ... ... ... 8.55 7.87 7.70 SCR1217-3557 1 12 17 55.8 −35 57 15 0.208 274.4 1 ... ... ... ... 15.05 13.06 11.02 13.94 12.78 11.35 1/ 9.94 9.33 9.09 SCR1220-8302 1 12 20 03.7 −83 02 29 0.244 244.3 1 ... ... ... ... 17.03 14.94 12.80 15.71 14.35 12.62 /71 10.97 10.39 10.07 LHS0326 1 12 24 26.8 −04 43 37 1.301 241.8 30 .02039 .00194 1 30 16.08 14.02 12.99 14.92 13.98 13.05 3/30u 11.93 11.43 11.23 SCR1224-8205 1 12 24 39.8 −82 05 53 0.273 183.3 1 ... ... ... ... 16.42 14.37 12.22 15.25 13.96 12.27 1/ 10.69 10.06 9.81 SCR1227-4039 1 12 27 03.9 −40 39 40 0.201 233.7 1 ... ... ... ... 13.00 10.82 9.40 11.96 11.03 10.03 1/ 8.93 8.27 8.08 LP909-006 1 12 30 19.6 −28 24 31 0.365 225.3 1 ... ... ... ... 16.51 14.41 11.64 15.39 14.10 12.45 1/ 10.85 10.27 9.96 LHS2573 1 12 32 32.2 −26 10 14 1.034 132.2 1 ... ... ... ... 14.35 12.22 10.44 13.47 12.40 11.03 2/ 9.75 9.23 9.02 LTT04828 1 12 39 55.9 −08 34 42 0.221 247.2 1 .02779 .00287 1 64 12.50 10.30 9.39 ... ... ... ... 8.64 8.02 7.82 WT1962 2 12 59 51.3 −07 30 35 0.501 291.0 74 ... ... ... ... 16.29J 14.15J 12.38J 15.42J 14.23J 12.68J 2/ 11.19J 10.68J 10.43J L147-045 1 13 04 43.8 −62 15 26 0.276 290.4 1 .02600 .00330 1 64 13.08 11.10 10.07 ... ... ... ... 8.48 7.85c 7.61 LHS2698 1 13 13 29.6 −32 27 05 0.533 266.3 1 .02159 .00092 1 47 15.34 13.34 11.50 14.21 13.14 11.76 /47 10.48 9.96 9.70 LP910-061 1 13 16 21.9 −33 47 45 0.203 175.1 1 .02556 .00285 1 64 12.89 11.04 9.61 ... ... ... ... 8.97 8.32 8.14 SCR1322-7254 1 13 22 27.5 −72 54 37 0.559 268.9 1 ... ... ... ... 16.24 14.12 12.25 15.33 14.13 12.60 2/ 11.14 10.55 10.31 SCR1328-7253 1 13 28 42.1 −72 53 47 0.808 251.0 1 ... ... ... ... 17.91 15.97 13.78 16.90 15.64 13.99 2/ 12.47 12.00 11.69 LHS2744 1 13 30 52.6 −32 37 49 0.695 241.4 1 .02618 .00227 1 64 12.39 10.73 9.24 ... ... ... ... 8.81 8.15 8.00 SIP1338-3752 1 13 38 26.5 −37 52 50 1.278 269.6 14 ... ... ... ... 17.72 15.76 13.14 16.75 15.25 13.39 2/ 11.75 11.28 10.97 LTT05294 1 13 39 37.6 −01 35 43 0.375 238.5 1 .03093 .00329 1 64 12.65 9.83 9.66 ... ... ... ... 8.76 8.12 7.88 SIP1343-3823 1 13 43 49.4 −38 23 50 0.264 244.1 1 ... ... ... ... 17.12 14.95 12.59 15.78 14.48 12.84 1/ 11.26 10.68 10.41 LTT05330 2(1) 13 44 55.1 −45 35 19 0.255 276.5 1 ... ... ... ... 11.85 9.71 9.72 11.29 10.41 9.51 1/ 8.47 7.86 7.66 SCR1347-7610 1 13 47 56.8 −76 10 20 0.194 089.7 1 ... ... ... ... 12.40 10.27 8.88 11.49 10.57 9.66 /71 8.62 8.01 7.77 LP912-026 1 13 53 19.8 −30 46 38 0.236 279.1 1 .03005 .00371 1 64 13.20 11.14 9.85 ... ... ... ... 8.90 8.26 8.05 LHS2841 1 14 00 57.0 −31 47 50 0.681 277.0 63 .02967 .00238 2 63,64 12.10 10.44 9.17 ... ... ... ... 8.22 7.57c 7.34 GJ0539.2 2(1) 14 09 27.2 −30 55 49 0.463 245.4 1 .02537 .00331 2 63,64 13.07 10.99 9.64 11.81 10.88 9.88 /5 8.79 8.12 7.90 SCR1410-2750 1 14 10 22.6 −27 50 59 0.186 241.6 1 ... ... ... ... 17.04 14.83 12.63 15.43 14.11 12.46 1/ 10.89 10.31 10.05 L836-121 3(2) 14 14 21.4 −15 21 22 0.239 222.0 1 .03314 .00490 1 64 10.58J 9.13J 7.63J 10.32J 9.49J 8.58J /67 7.43J 6.78J 6.60J LHS5275 1 14 39 58.8 −56 54 46 0.533 126.2 1 .01770 .00880 1 63 12.66 10.05 ... ... ... ... ... 8.33 7.71 7.52 SCR1450-3742 1 14 50 02.9 −37 42 10 0.445 208.9 1 ... ... ... ... 14.82 12.40 10.44 14.01 12.84 11.32 /71 9.95 9.37 9.07 LHS0381 1 14 50 28.9 −08 38 37 1.560 188.4 1 .02740 .00540 1 63 16.53 14.36 13.18 15.10 14.11 13.07 2/ 11.97 11.46 11.24 LHS0382 1 14 50 41.2 −16 56 31 1.429 244.0 29 .02069 .00225 1 29 16.40 14.27 12.30 15.73 14.61 13.17 2/29u 11.85 11.38 11.11 LHS0385 1 14 55 35.8 −15 33 44 1.736 209.6 36 .02040 .00580 1 63 15.47 13.39 12.23 14.61 13.67 12.78 3/ 11.74 11.28 11.06 SCR1510-5141 1 15 10 56.6 −51 41 36 0.328 276.1 1 ... ... ... ... 13.95 11.32 9.59 13.04 11.96 10.64 1/ 9.39 8.84c 8.58 UPM1515-6258 1 15 15 04.9 −62 58 06 0.225 239.9 1 ... ... ... ... 16.90 16.13 14.79 15.74 14.60 13.13 1/ 11.74 11.13 10.85 LP915-016 2 15 17 21.1 −27 59 50 0.193 252.2 1 .03398 .00377 1 64 11.83J 9.83J 9.18J 11.05J 10.17J 9.30J /34 8.23J 7.60J 7.42J UPM1523-5454 1 15 23 43.7 −54 54 35 0.210 343.2 20 ... ... ... ... ... ... ... 13.45 12.37 11.08 1/ 9.77 9.19 8.87 LP802-068 1 15 24 45.8 −17 07 39 0.391 236.8 1 .02892 .00519 1 64 12.53 10.75 9.24 ... ... ... ... 8.41 7.73 7.53 SCR1528-3807 1 15 28 50.6 −38 07 41 0.375 232.5 1 ... ... ... ... 13.74 11.96 10.63 12.27 11.34 10.34 1/ 9.28 8.59 8.38 LEHPM2-0016 1 15 29 14.0 −29 07 38 1.034 188.4 1 .02782 .00103 1 30 20.38 18.43 15.48 19.38 17.52 15.28 /30 13.32 12.86 12.50 SCR1532-3622 1 15 32 13.9 −36 22 31 0.438 235.4 1 ... ... ... ... 15.48 13.50 11.96 14.03 12.89 11.45 /71 10.10 9.54 9.28 LP916-023 1 15 44 05.5 −32 05 22 0.345 233.0 1 ... ... ... ... 14.92 12.91 11.14 13.74 12.62 11.18 /44 9.81 9.21 8.94

– 67 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

L336-071 1 15 49 38.3 −47 36 34 0.390 174.1 1 .03680 .00242 2 63,64 11.94 9.85 8.93 11.16 10.24 9.35 /33 8.30 7.68c 7.50 LP916-003 1 15 54 23.5 −33 08 44 0.308 220.2 1 ... ... ... ... 13.61 11.62 10.34 12.02 11.07 10.02 /44 8.85 8.20 8.02 LP684-003 1 15 56 41.4 −04 14 21 0.193 310.2 28 .02449 .00365 1 64 12.41 10.35 9.40 ... ... ... ... 8.68 8.09 7.83 LHS3144 1 16 00 27.8 −34 43 17 1.026 254.5 1 ... ... ... ... 15.13 12.96 11.32 13.58 12.49 11.09 /46 9.75 9.26 8.98 LHS3147 1 16 02 23.6 −25 05 57 0.661 200.4 1 .03918 .00137 1 47 14.06 11.61 9.59 13.20 12.09 10.63 /47 9.28 8.69 8.41 SCR1608-4442 1 16 08 43.9 −44 42 29 0.628 193.1 60 ... ... ... ... 16.59 14.95 12.94 15.40 14.12 12.46 1/ 10.88 10.36 10.10 SCR1609-3730 1 16 09 05.4 −37 30 40 0.195 184.0 1 ... ... ... ... 14.30 12.34 11.44 12.71 11.79 10.85 1/ 9.81 9.19 8.99 LEP1610-0040 2 16 10 29.0 −00 40 54 1.425 208.7 1 ... ... ... ... 21.22J 17.70J 14.90J 19.09J 17.10J 14.97J 2/ 12.91J 12.30J 12.02J GJ0618.1 1 16 20 24.8 −04 16 02 0.385 264.1 1 .02984 .00213 2 63,64 11.43 9.54 8.36 10.69 9.83 8.97 /5 7.95 7.27 7.08 LP745-070 1 16 33 41.6 −09 33 12 0.198 198.3 1 .03260 .00247 1 64 12.37 10.09 9.51 ... ... ... ... 8.38 7.78c 7.55 SCR1637-4703 1 16 37 56.6 −47 03 44 0.493 219.2 1 ... ... ... ... 16.26 13.88 11.56 14.77 13.57 12.04 /71 10.60 10.04 9.70 2MA1651-2719 1 16 51 59.8 −27 19 51 0.666 193.9 39 ... ... ... ... ... ... ... 15.38 14.17 12.56 1/ 10.96 10.39 10.10 CCD1702-2718 2(1) 17 02 09.1 −27 18 24 0.236 161.8 1 ... ... ... ... 13.22 11.48 10.00 11.82 10.94 10.07 1/ 8.88 8.25 8.02 LP806-025 1 17 07 58.3 −19 28 43 0.260 204.5 1 ... ... ... ... 15.89 14.07 12.48 12.98 11.92 10.63 1/ 9.35 8.78 8.55 NLTT44264 1 17 10 03.8 −21 46 56 0.255 221.4 1 ... ... ... ... 15.69 13.64 12.30 12.65 11.65 10.52 2/ 9.36 8.76 8.51 SCR1712-1907 1 17 12 26.1 −19 07 04 0.231 117.6 1 ... ... ... ... 17.03 15.40 14.10 14.52 13.43 12.08 1/ 10.72 10.16 9.90 SCR1716-2239 1 17 16 35.7 −22 39 49 0.288 183.6 1 ... ... ... ... 16.49 14.75 13.38 14.80 13.63 12.12 1/ 10.69 10.07 9.84 UPM1718-2245 2(1) 17 18 25.6 −22 46 29 0.213 219.3 1 ... ... ... ... 16.14 14.79 13.29 14.07 13.01 11.69 1/ 10.21 9.61 9.38 LHS0440 1 17 18 32.3 −43 26 38 1.083 233.3 30 .03640 .00122 1 30 13.55 10.68 10.04 12.98 11.98 10.87 3/30u 9.70 9.13 8.95 LP920-011 1 17 19 13.7 −27 45 44 0.263 217.0 1 ... ... ... ... 15.76 13.82 13.50 13.81 12.71 11.36 1/ 10.03 9.40 9.20 GJ1217 1 17 22 43.0 −14 57 37 0.216 193.3 1 .03717 .00280 1 64 11.92 9.81 9.17 10.93 10.08 9.26 /68 8.25 7.63 7.44 LP687-026 1 17 22 50.6 −03 29 38 0.225 218.2 1 ... ... ... ... 14.92 13.77 12.54 13.81 12.75 11.48 1/ 10.21 9.58 9.35 SCR1724-3727 1 17 24 07.0 −37 27 53 0.241 203.9 1 ... ... ... ... 16.53 14.58 12.64 15.00 13.78 12.20 1/ 10.69 10.13 9.80 SCR1733-2452 1 17 33 04.6 −24 52 57 0.251 181.9 1 ... ... ... ... 15.64 14.40 14.36 14.04 13.02 11.84 1/ 10.63 9.97 9.77 SCR1735-4051 1 17 35 15.5 −40 51 13 0.217 187.4 1 ... ... ... ... 17.98 16.29 13.82 16.70 15.28 13.41 1/ 11.61 11.04 10.70 LTT07022 1 17 39 28.3 −22 41 46 0.309 200.1 1 .02300 .00920 1 63 12.64 11.20 11.00 ... ... ... ... 8.60 7.95 7.78 SCR1750-2530 1 17 50 07.6 −25 30 21 0.270 226.7 1 ... ... ... ... 16.75 14.89 12.48 15.06 13.78 12.25 1/ 10.65 9.95 9.68 SCR1750-0128 1 17 50 14.4 −01 28 51 0.324 199.7 1 ... ... ... ... 15.43 13.93 12.21 14.56 13.38 11.84 1/ 10.43 9.89 9.64 LHS0456 1 17 50 59.0 −56 36 07 1.256 238.0 63 ... ... ... ... 12.95 10.91 9.93 12.08 11.12 10.09 3/ 8.99 8.42 8.19 LP808-023 1 17 51 27.5 −18 59 32 0.334 165.2 1 .02271 .00292 1 64 13.43 11.46 11.15 ... ... ... ... 8.87 8.22 8.06 SCR1753-7403 1 17 53 32.6 −74 03 46 0.181 194.7 1 ... ... ... ... 16.28 14.04 11.80 15.05 13.76 12.09 1/ 10.56 9.96 9.70 SCR1755-0455 1 17 55 30.7 −04 55 42 0.195 073.0 1 ... ... ... ... 16.63 15.34 13.76 15.19 13.90 12.25 1/ 10.70 10.08 9.78 SCR1800-0755 1 18 00 33.9 −07 55 03 0.197 226.1 1 ... ... ... ... 14.71 13.56 12.08 13.36 12.30 10.99 1/ 9.86 9.26 8.98 SCR1801-7000 1 18 01 28.9 −70 00 49 0.240 160.8 1 ... ... ... ... 15.10 13.00 10.97 14.00 12.87 11.42 1/ 10.01 9.41 9.16 SCR1802-1919 1 18 02 28.7 −19 19 19 0.189 156.8 1 ... ... ... ... 16.14 14.51 13.76 14.18 13.13 11.85 1/ 10.64 9.97 9.77 L077-206 1 18 06 55.6 −74 35 20 0.410 160.0 38 ... ... ... ... 15.06 13.13 10.66 14.05 12.97 11.59 2/ 10.18 9.69 9.45 LEHPM2-0088 1 18 08 00.0 −81 20 49 0.698 197.5 1 ... ... ... ... ... 15.45 13.19 16.02 14.69 13.00 1/ 11.36 10.79 10.52 SCR1808-0341 1 18 08 48.4 −03 41 54 0.424 197.2 60 ... ... ... ... 16.74 16.07 15.40 15.37 14.32 13.01 2/ 11.72 11.19 11.03 LTT07218 1 18 09 33.3 −12 02 20 0.216 162.2 28 .03519 .00253 2 63,64 11.80 10.10 9.21 ... ... ... ... 7.80 7.16 6.99 LEP1809-0247 1 18 09 50.1 −02 47 43 1.022 214.7 1 ... ... ... ... 17.68 17.03 15.84 16.25 14.87 13.04 1/ 11.43 10.92 10.68 SCR1820-6225 1 18 20 49.4 −62 25 53 0.192 161.5 1 ... ... ... ... 12.84 10.95 9.63 12.04 11.12 10.17 /71 9.14 8.49 8.30 GJ1226 2 18 20 57.2 −01 02 58 1.079 209.4 1 .03410a .00400 2 29,29 13.47J 12.10J 9.79J 13.07 11.98 10.56 /29 8.75J 8.19J 7.95J SCR1821-0700 1 18 21 54.2 −07 00 18 0.200 215.8 1 ... ... ... ... 13.93 12.57 12.34 12.70 11.76 10.71 1/ 9.63 8.91 8.73 G155-020 2(1) 18 31 04.4 −09 58 09 0.217 355.9 1 ... ... ... ... 15.07 13.72 12.30 13.98 12.85 11.40 1/ 9.99 9.36 9.12 SCR1842-2736 1 18 42 56.7 −27 36 33 0.254 160.2 1 ... ... ... ... 13.43 11.80 10.95 13.04 12.13 11.13 1/ 10.02 9.36 9.18 SCR1844-1310 1 18 44 59.6 −13 10 24 0.204 213.1 1 ... ... ... ... 16.13 14.84 13.75 14.52 13.42 12.04 1/ 10.69 10.12 9.89 G155-041 1 18 47 36.0 −17 03 16 0.218 248.0 37 ... ... ... ... 15.09 13.54 12.04 13.61 12.58 11.29 /46 10.04 9.46 9.23 LHS0468 1 18 48 44.9 −02 33 46 1.083 235.5 1 .03500 .00440 1 63 15.18 13.35 12.26 13.54 12.54 11.35 1/ 10.16 9.65 9.42 SCR1851-6156 1 18 51 55.4 −61 56 56 0.328 245.2 1 ... ... ... ... 14.09 12.10 10.30 13.19 12.12 10.78 1/ 9.50 8.88 8.69

– 68 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′yr−1 ) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS3421 1 18 52 52.4 −57 07 37 0.773 194.1 1 .03762 .00382 2 63,64 13.09 11.26 9.65 ... ... ... ... 8.52 7.84 7.59 SCR1853-7537 1 18 53 26.6 −75 37 40 0.278 166.9 1 ... ... ... ... 12.20 9.85 9.09 11.18 10.29 9.41 /71 8.34 7.73 7.50 SCR1854-2859 1 18 54 20.8 −28 59 53 0.183 178.2 1 ... ... ... ... 15.30 13.86 13.03 13.42 12.44 11.22 1/ 10.01 9.42 9.20 SCR1900-2547 1 19 00 47.1 −25 47 13 0.234 184.5 1 ... ... ... ... 15.25 13.26 11.50 14.15 12.99 11.54 1/ 10.13 9.52 9.28 SCR1907-7924 1 19 07 53.5 −79 24 03 0.271 038.6 1 ... ... ... ... 15.53 13.59 11.77 14.38 13.22 11.78 1/ 10.36 9.82 9.56 SCR1916-3638 1 19 16 46.6 −36 38 06 1.328 184.0 1 .01478 .00137 1 30 18.20 15.88 14.78 16.83 15.82 14.76 /30 13.66 13.12 12.95 LP347-017 1 19 19 09.0 −45 47 59 0.457 174.0 1 .02587 .00353 1 64 12.32 10.19 9.28 ... ... ... ... 8.52 7.83 7.64 LHS3451 2(1) 19 19 29.3 −18 19 06 0.576 158.4 1 ... ... ... ... 15.34 12.84 11.45 14.77 13.71 12.35 1/ 11.02 10.52 10.33 LEHPM2-3658 2(1) 19 22 43.7 −43 19 21 0.189 142.3 1 ... ... ... ... 13.79 11.54 9.84 12.88 11.78 10.53 1/ 9.28 8.70 8.46 L347-073 1 19 26 30.2 −48 36 16 0.423 155.9 1 ... ... ... ... 14.04 11.80 9.90 13.06 11.96 10.63 2/ 9.39 8.85c 8.53 L347-072 1 19 27 30.9 −48 33 53 0.437 153.7 1 ... ... ... ... 13.87 11.67 9.93 12.88 11.85 10.63 2/ 9.43 8.87c 8.62 L208-005 1 19 30 13.7 −54 56 19 0.324 176.1 1 .02889 .00273 1 64 12.24 9.93 9.43 ... ... ... ... 8.65 8.04 7.87 SCR1932-0652 1 19 32 46.3 −06 52 18 0.318 193.3 1 ... ... ... ... 14.92 13.27 11.50 13.97 12.83 11.34 /71 9.94 9.36 9.10 GJ0762 1 19 34 36.5 −62 50 39 0.515 222.7 1 .03889 .00133 2 47,63 13.18 11.32 9.88 12.09 11.07 9.83 /47 8.59 8.00c 7.77 SCR1936-4816 1 19 36 33.3 −48 16 54 0.310 073.4 1 ... ... ... ... 17.23 15.05 12.55 15.92 14.50 12.76 1/ 11.05 10.47 10.18 LTT07786 3(1) 19 42 52.8 −45 04 53 0.239 190.1 1 .03659 .00218 2 63,64 10.68 8.73 7.59 ... ... ... ... 7.30 6.66 6.45 LHS3480 1 19 44 22.0 −22 30 54 0.547 139.5 1 .01770 .00080 1 63 18.50 16.41 14.60 17.27 16.00 14.46 1/ 13.05 12.53 12.25 LHS3492 1 19 51 31.3 −50 55 38 0.827 191.8 1 ... ... ... ... 16.52 14.58 12.29 15.27 14.05 12.45 3/ 10.97 10.49 10.19 GJ0769 1 19 54 00.1 −47 48 37 1.041 185.6 1 .03960 .00850 1 63 13.72 11.43 10.59 12.53 11.52 10.28 /5 9.08 8.54 8.29 SCR1954-7356 1 19 54 06.4 −73 56 51 0.581 147.3 1 ... ... ... ... 16.85 14.89 12.96 15.78 14.64 13.17 1/ 11.81 11.31 11.08 SCR1955-2856 1 19 55 16.8 −28 56 43 0.253 150.4 1 ... ... ... ... 15.10 13.12 11.35 14.14 12.92 11.46 1/ 10.04 9.48 9.22 SCR1959-5549 1 19 59 58.8 −55 49 30 0.438 168.0 1 ... ... ... ... 16.19 13.95 11.82 14.85 13.59 11.98 1/ 10.47 9.88 9.63 L277-205 1 20 03 52.4 −53 57 28 0.228 319.3 1 ... ... ... ... 14.22 12.21 10.32 13.03 11.99 10.68 2/ 9.42 8.77 8.59 L277-082 1 20 10 45.4 −51 19 39 0.226 163.6 1 ... ... ... ... 13.43 11.35 10.34 12.56 11.65 10.73 2/ 9.71 9.07 8.87 LHS3528 1 20 10 55.5 −25 35 09 0.848 166.6 36 ... ... ... ... 15.97 13.99 11.20 13.11 12.06 10.76 /45 10.22 9.61 9.35 LP814-044 1 20 17 52.4 −17 17 09 0.328 183.3 1 .02851 .00228 1 64 11.84 10.15 7.99 ... ... ... ... 8.37 7.69 7.55 LP815-001 1 20 20 07.1 −19 39 03 0.193 131.1 1 ... ... ... ... 13.42 11.35 8.74 12.33 11.34 10.20 /45 9.01 8.44 8.21 WT0708 1 20 27 04.4 −68 41 07 0.501 114.6 73 ... ... ... ... 18.66 16.34 13.74 17.26 15.75 13.86 1/ 11.99 11.38 11.13 LTT08147 1 20 36 43.6 −02 41 20 0.395 087.0 37 ... ... ... ... 12.77 10.48 9.98 12.13 11.18 10.10 /70 8.93 8.28 8.10 SCR2042-5737 2 20 42 46.4 −57 37 15 0.264 142.6 1 ... ... ... ... 15.07J 13.22J 11.56J 14.12J 12.89J 11.33J /71 9.97J 9.53J 9.03J SCR2043-6501 1 20 43 10.4 −65 01 17 0.573 169.7 1 ... ... ... ... 16.18 14.04 12.04 14.97 13.88 12.52 1/ 11.25 10.76 10.52 LHS3582 1 20 46 18.0 −47 09 28 0.499 174.6 1 .03080 .00970 1 63 12.23 10.17 8.89 ... ... ... ... 8.72 8.14 7.90 2MA2051-2458 1 20 51 09.8 −24 58 18 0.234 115.1 1 ... ... ... ... 15.71 13.47 11.62 14.51 13.26 11.70 1/ 10.20 9.64 9.37 LHS3600 1 20 55 59.9 −59 56 44 0.619 125.3 1 .03604 .00247 1 64 13.17 11.55 9.99 ... ... ... ... 8.44 7.78 7.60 LEHPM1-4008 1 20 58 30.4 −65 01 11 0.514 149.9 1 ... ... ... ... 18.14 15.90 13.78 16.61 15.22 13.48 1/ 11.80 11.21 10.89 LP816-061 1 20 59 06.6 −16 05 37 0.279 202.9 1 .02962 .00255 1 64 12.28 10.26 9.16 ... ... ... ... 8.60 8.03 7.80 L211-096 1 20 59 51.3 −58 45 31 0.363 158.0 1 .03314 .00320 1 64 13.31 11.69 10.25 ... ... ... ... 8.66 8.06 7.82 SCR2102-3128 2(1) 21 02 15.6 −31 28 13 0.184 192.6 1 ... ... ... ... 14.17 12.17 10.27 13.26 12.19 10.86 1/ 9.57 8.97 8.73 LHS3620 1 21 04 25.4 −27 52 47 0.985 184.4 1 .01288 .00140 1 30 17.69 15.60 14.36 16.61 15.59 14.53 /30 13.41 12.89 12.70 LEHPM1-4021 1 21 05 11.4 −62 47 02 0.535 131.3 1 ... ... ... ... 18.32 16.31 14.10 17.01 15.55 13.80 1/ 12.17 11.64 11.36 SCR2105-3515 1 21 05 41.8 −35 15 00 0.237 098.8 1 ... ... ... ... 15.06 12.93 10.88 14.03 12.87 11.41 1/ 10.02 9.46 9.18 LHS0505 1 21 11 57.9 −31 03 16 1.060 125.0 36 ... ... ... ... 22.25 15.33 ... 16.25 14.93 13.20 1/ 11.62 11.10 10.84 LEHPM1-4051 1 21 15 15.1 −75 41 52 1.053 144.6 30 .03296 .00128 1 30 15.47 13.37 11.13 14.48 13.25 11.66 /30 10.14 9.60 9.33 LP637-024 1 21 19 18.3 −00 33 19 0.379 220.8 28 .02473 .00366 1 64 12.22 10.18 9.03 ... ... ... ... 8.72 8.06 7.87 GJ0836.4 1 21 42 07.5 −12 09 48 0.719 170.4 1 .02860 .00260 1 63 13.32 11.32 9.48 12.83 11.74 10.35 /5 8.92 8.30 8.02 L048-001 1 21 42 58.5 −74 05 56 0.210 162.1 1 ... ... ... ... 14.24 12.20 10.59 13.06 12.02 10.74 /71 9.46 8.78 8.58 CD-32 16735 1 21 47 02.7 −32 24 40 0.206 071.2 1 -.00469 .00388 0 10.27 7.74 6.46 9.22 8.11 6.70 3/ 5.24 4.41c 4.06 L282-061 1 21 51 12.3 −52 15 40 0.353 126.8 1 .03155 .00251 1 64 12.14 10.23 8.94 11.36 10.47 9.62 /33 8.61 8.00 7.82 LHS0515 1 21 55 48.0 −11 21 43 1.088 120.0 63 .01950 .00400 1 63 18.89 16.39 15.10 17.39 16.20 14.87 2/ 13.64 13.19 12.91

– 69 –

Table 1—Continued

Name # comp. RA DEC μ P.A. ref π π error # π ref BJ R59F IIV N VJ RKC IKC # nts/ref J H Ks (′′ yr−1) (deg) (′′ ) (′′ ) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (mags) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21)

LHS3740 1 21 58 53.2 −57 56 04 0.923 096.9 1 .03594 .00145 1 30 15.13 13.09 10.90 14.06 12.88 11.33 /30 9.85 9.27 9.00 LHS3754 1 22 04 40.9 −19 46 42 0.895 110.0 36 ... ... ... ... 15.15 10.77 10.32 14.28 13.21 11.93 1/ 10.54 10.15 9.85 LHS3775 1 22 12 56.0 −18 15 21 0.646 194.1 1 ... ... ... ... 15.69 13.53 11.90 14.55 13.59 12.45 1/ 11.29 10.77 10.52 LP699-075 1 22 18 13.2 −03 10 20 0.253 096.6 1 .02458 .00197 1 64 11.86 10.08 8.95 ... ... ... ... 8.34 7.73 7.52 LEHPM1-4592 1 22 21 11.4 −19 58 15 1.066 125.1 1 ... ... ... ... 21.09 18.84 16.07 19.96 18.16 15.98 3/ 14.19 13.74 13.48 WT0918 1 22 21 37.0 −65 47 30 0.697 092.2 1 ... ... ... ... 17.54 15.19 12.82 16.27 15.02 13.32 1/ 11.66 11.07 10.75 LP931-054 1 22 23 18.0 −27 09 15 0.450 196.0 1 ... ... ... ... 16.26 14.17 11.78 14.65 13.44 11.86 /45 10.36 9.79 9.51 SCR2224-7242 1 22 24 51.6 −72 42 00 0.190 250.2 1 ... ... ... ... 15.80 13.80 11.79 14.80 13.56 11.99 1/ 10.46 9.87 9.57 LEHPM1-4828 1 22 32 42.7 −60 16 34 0.513 182.4 1 ... ... ... ... 16.92 14.86 12.95 15.55 14.31 12.74 1/ 11.25 10.70 10.45 LHS3836 1 22 38 02.9 −65 50 09 0.694 118.9 47 .03642 .00132 1 47 15.13 13.09 11.07 14.34 13.14 11.61 /47 10.18 9.67 9.41 LP932-053 1 22 39 44.0 −32 04 18 0.244 223.1 1 .02519 .00215 1 64 11.84 9.73 9.01 ... ... ... ... 8.34 7.68 7.52 SCR2241-6119 2(1) 22 41 44.4 −61 19 31 0.184 124.1 1 ... ... ... ... 15.64 13.65 11.70 14.41 13.21 11.66 /71 10.21 9.61 9.35 SCR2242-5103 2 22 42 10.9 −51 03 28 0.182 225.9 1 ... ... ... ... 12.78J 10.98J 9.44J 12.27J 11.33J 10.20J 1/ 9.20J 8.66J 8.36J LHS3846 1 22 44 00.2 −04 57 57 0.670 051.4 1 ... ... ... ... 16.00 13.61 11.45 15.19 14.08 12.70 1/ 11.40 10.89 10.63 L106-104 1 22 46 45.2 −63 18 05 0.238 122.5 1 .03990 .00304 1 64 12.14 10.33 8.84 11.41 10.46 9.41 /33 8.29 7.71 7.45 LTT09210 1 22 48 53.0 −28 50 03 0.284 215.6 1 .02491 .00219 1 64 11.44 9.35 8.47 10.67 9.81 8.96 2/ 7.90 7.28 7.08 LTT09203 1 22 48 54.5 −54 18 52 0.434 143.3 1 .02981 .00265 1 64 12.67 10.36 9.52 11.24 10.33 9.43 /33 8.36 7.70 7.55 L214-072 1 22 49 26.0 −58 15 12 0.321 123.6 1 .02730 .00232 1 64 11.98 9.96 8.91 ... ... ... ... 8.28 7.63c 7.46 SCR2250-5726 2(1) 22 50 45.0 −57 26 02 0.712 117.9 1 ... ... ... ... 18.07J 16.10J 13.80J 17.76 16.34 14.54 1/ 12.63J 12.00J 11.81J LP933-024 2 22 55 43.9 −30 22 39 0.384 062.4 28 .03095 .00275 1 64 12.66J 10.16J 9.24J ... ... ... ... 8.56 7.90 7.71 LHS5396 1 23 00 23.6 −31 07 12 0.464 201.4 1 .03248 .00247 1 64 12.27 9.51 8.72 11.07 10.15 9.20 /33 8.13 7.48 7.25 L286-071 1 23 00 26.1 −53 13 40 0.255 211.2 1 .02418 .00186 1 64 11.93 10.08 9.19 ... ... ... ... 8.35 7.78 7.61 SCR2312-3124 1 23 12 08.7 −31 24 04 0.200 102.3 1 ... ... ... ... 17.18 14.88 12.56 15.69 14.43 12.74 1/ 11.13 10.53 10.26 LHS5397 1 23 14 15.4 −56 50 52 0.440 239.8 1 .03575 .00302 1 64 13.29 11.29 9.81 ... ... ... ... 8.87 8.22 8.01 L168-009 1 23 20 07.5 −60 03 55 0.332 246.3 1 .03792 .00223 1 64 11.61 9.63 8.06 11.01 10.07 9.06 /33 7.94 7.32c 7.08 LTT09507 1 23 21 11.3 −01 35 45 0.367 198.8 1 .03585 .00404 2 63,64 12.76 10.77 9.33 ... ... ... ... 8.70 8.13 7.82 GJ0895.1 1 23 25 42.0 −45 36 35 0.490 093.6 1 .02786 .00280 2 63,64 12.02 9.63 8.82 11.26 10.32 9.34 /33 8.23 7.59 7.37 SCR2325-8057 1 23 25 52.9 −80 57 41 0.233 106.3 1 ... ... ... ... 16.22 13.03 11.84 15.28 14.05 12.42 1/ 10.85 10.26 9.98 L288-049 1 23 41 43.6 −51 56 37 0.257 184.5 1 .03629 .00403 1 64 12.79 10.30 9.20 ... ... ... ... 8.63 8.00 7.79 LEHPM1-6094 1 23 42 02.3 −78 41 23 0.567 087.8 1 ... ... ... ... 16.09 13.81 11.67 15.02 13.79 12.29 1/ 10.89 10.36 10.06 WT1026 1 23 46 35.2 −52 47 02 0.716 188.2 1 ... ... ... ... 15.82 13.64 12.18 14.78 13.76 12.59 1/ 11.42 10.89 10.68 LP1035-064 1 23 47 56.5 −39 11 13 0.284 138.0 38 ... ... ... ... 15.73 13.61 11.54 14.42 13.24 11.70 1/ 10.19 9.58 9.32 LHS4025 1 23 50 52.6 −39 05 17 0.782 105.2 36 ... ... ... ... 15.93 13.47 11.43 14.44 13.19 11.64 1/ 10.16 9.59 9.31 SCR2352-6124 1 23 52 29.5 −61 24 23 0.869 166.6 1 ... ... ... ... 17.10 14.73 12.63 15.65 14.45 12.93 1/ 11.52 11.02 10.82 L361-021 1 23 57 45.6 −45 48 55 0.389 113.2 1 .02439 .00291 2 63,64 12.11 10.00 8.81 11.13 10.25 9.38 /33 8.36 7.71 7.52

Note. — A ’J’ next to a photometry value indicates that the magnitude is blended due to a close companion.

Note. — A ’u’ next to the photometry reference code indicates an updated value since the last publication from the RECONS group due to aquisition of more data.

Note. — References: (1) this paper; (2) Andrei et al. (2011); (3) Anglada-Escudé et al. (2012); (3) Benedict et al. (2002); (5) Bessel (1990); (6) Bessell (1991); (7) Biller & Close (2007); (8) Boyd et al. (2011a); (9) Costa & Méndez (2003); (10) Costa et al. (2005); (11) Costa et al. (2006); (12) Deacon & Hambly (2001); (13) Deacon et al. (2005a); (14) Deacon et al. (2005b); (15) Deacon & Hambly (2007); (16) Dieterich et al. (2014); (17) Dupuy & Liu (2012); (18) Fabricius & Makarov (2000); (19) Faherty et al. (2012); (20) Finch et al. (2010); (21) Finch et al. (2012); (22) Gatewood et al. (2003); (23) Gizis et al. (2011); (24) Henry et al. (2004); (25) Henry et al. (2006); (26) Henry et al. (1997); (27) Hershey & Taff (1998); (28) Høg et al. (2000); (29) Jao et al. (2005); (30) Jao et al. (2011); (31) Jao et al. (2014); (32) Kilkenny et al. (2007); (33) Koen et al. (2002); (34) Koen et al. (2010); (35) Lépine (2008); (36) Luyten (1979a); (37) Luyten (1980a); (38) Luyten (1980b); (39) Monet et al. (2003); (40) Patterson et al. (1998); (41) Phan-Bao (2011); (42) Pokorny et al. (2003); (43) Pokorny et al. (2004); (44) Reid et al. (2002); (45) Reid et al.

– 70 –

(2003); (46) Reid et al. (2004); (47) Riedel et al. (2010); (48) Riedel et al. (2011); (49) Riedel et al. (2014); (50) Ruiz et al. (2001); (51) Ruiz et al. (1993); (52) Schilbach et al. (2009); (53) Schmidt et al. (2007); (54) Scholz et al. (2004); (55) Shkolnik et al. (2012); (56) Smart et al. (2007); (57) Smart et al. (2010); (58) Söderhjelm (1999); (59) Subasavage et al. (2005a); (60) Subasavage et al. (2005b); (61) Tinney et al. (1995); (62) Tinney (1996); (63) van Altena et al. (1995); (64) van Leeuwen (2007); (65) von Braun et al. (2011); (66) Weis (1991a); (67) Weis (1991b); (68) Weis (1993); (69) Weis (1996); (70) Weis (1999); (71) Winters et al. (2011); (72) Wolf & Reinmuth (1925); (73) Wroblewski & Torres (1994); (74) Wroblewski & Torres (1997).

aThe weighted mean parallax includes the parallax of both the primary and the secondary components. bThe HIP parallax is markedly different from that published in YPC and has an error of ∼45 mas. c2MASS magnitude error greater than 0.05 mags.

– 71 –

Table 2. Derived Data for Southern Red Dwarf Systems

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

2MA0000-1245 00 00 28.7 −12 45 16 22.2 7.6 7 23.1 4.0 11 ... ... ... 23.1 ccd LTT09844 00 00 46.9 −35 10 06 23.5 7.4 11 ... ... ... ... ... ... 23.5 plt GJ1001 00 04 36.5 −40 44 03 11.2 3.4 11 12.5 1.9 12 12.5 0.6 2 12.5 trg G158-025 00 04 40.3 −09 52 42 24.5 7.4 11 ... ... ... ... ... ... 24.5 plt SIP0004-2058 00 04 41.5 −20 58 30 14.9 6.8 10 18.6 3.0 11 ... ... ... 18.6 ccd GJ0001 00 05 24.4 −37 21 27 3.7 1.0 11 5.6 0.9 11 4.3 0.0 2 4.3 trg LP644-034 00 05 34.9 −06 07 07 23.0 6.2 11 ... ... ... ... ... ... 23.0 plt LP644-039 00 06 13.1 −02 32 11 27.3 9.2 11 21.9 3.9 12 ... ... ... 21.9 ccd LHS1019 00 06 19.2 −65 50 26 16.1 4.6 11 16.6 2.6 12 16.7 0.7 1 16.7 trg GJ1002 00 06 43.2 −07 32 17 6.8 2.1 11 5.4 1.0 12 4.7 0.1 1 4.7 trg L217-028 00 08 17.4 −57 05 53 17.3 5.9 11 13.2 2.0 12 ... ... ... 13.2 ccd GJ0007 00 09 04.3 −27 07 20 24.1 6.6 11 28.1 4.7 9 22.9 1.4 2 22.9 trg LP644-094 00 09 13.5 −04 08 02 19.8 5.6 11 20.4 3.2 12 ... ... ... 20.4 ccd BPM46052 00 09 20.0 −21 14 41 16.0 4.8 11 ... ... ... ... ... ... 16.0 plt LEHPM1-0254 00 09 43.3 −41 17 36 23.4 8.7 11 ... ... ... ... ... ... 23.4 plt LEHPM1-0255 00 09 45.1 −42 01 40 10.8 3.2 11 12.5 2.0 12 ... ... ... 12.5 ccd L217-009 00 11 49.1 −55 21 52 22.2 10.3 11 ... ... ... ... ... ... 22.2 plt GJ1005 00 15 28.1 −16 08 02 [8.0] 2.2 11 [6.7] 1.1 12 5.9 0.0 4 5.9 trg LHS1051 00 15 51.5 −67 59 52 14.0 3.9 11 17.5 2.8 12 ... ... ... 17.5 ccd L290-072 00 16 02.0 −48 15 39 [15.4] 4.2 11 [14.1] 2.2 12 22.8 2.3 1 22.8 trg L218-009 00 16 36.6 −50 16 09 26.5 7.3 11 26.3 4.1 12 22.2 1.7 1 22.2 trg SCR0017-3219 00 17 15.7 −32 19 54 21.0 7.4 11 21.3 3.4 12 ... ... ... 21.3 ccd LP704-074 00 17 28.2 −08 44 23 23.2 6.3 11 ... ... ... ... ... ... 23.2 plt LTT00139 00 17 40.7 −01 22 41 20.3 5.6 11 23.5 3.8 12 ... ... ... 23.5 ccd LTT00151 00 18 44.8 −34 50 15 16.0 5.6 11 ... ... ... ... ... ... 16.0 plt LP825-035 00 20 23.2 −23 46 05 23.4 7.9 11 ... ... ... ... ... ... 23.4 plt L170-007 00 20 41.5 −53 40 54 24.6 6.5 11 ... ... ... ... ... ... 24.6 plt GJ0017.1 00 21 19.6 −45 44 47 12.9 3.6 11 15.4 2.5 11 17.3 0.6 2 17.3 trg LHS5004a 00 21 37.3 −46 05 33 14.5 3.9 11 13.1 2.1 12 19.3 1.7 1 19.3 trg LTT00180 00 21 39.4 −09 00 25 19.8 6.6 11 20.9 3.3 12 ... ... ... 20.9 ccd G158-066 00 21 53.4 −09 38 03 23.4 7.4 11 ... ... ... ... ... ... 23.4 plt L086-082 00 21 54.9 −68 31 26 17.8 5.1 11 23.3 3.8 10 ... ... ... 23.3 ccd GJ1009 00 21 56.1 −31 24 22 11.2 3.7 11 12.9 2.2 12 18.0 0.8 1 18.0 trg L026-099 00 22 27.1 −79 09 59 20.8 5.8 11 ... ... ... ... ... ... 20.8 plt LHS1064 00 23 18.5 −50 53 38 12.7 3.4 11 15.2 2.5 12 20.0 1.1 2 20.0 trg LTT00214 00 24 25.2 −12 17 25 23.6 6.4 11 23.4 3.6 12 ... ... ... 23.4 ccd GJ2005 00 24 44.2 −27 08 24 [6.1] 1.8 11 [6.0] 1.0 12 7.7 0.1 2 7.7 trg LTT00220 00 25 04.3 −36 46 18 13.8 4.8 11 16.8 2.6 12 ... ... ... 16.8 ccd SCR0027-0806 00 27 45.4 −08 06 05 22.9 6.6 11 18.6 2.9 12 ... ... ... 18.6 ccd LTT00250 00 28 05.0 −23 00 37 22.7 7.0 11 ... ... ... ... ... ... 22.7 plt GJ1012 00 28 39.5 −06 39 49 10.6 4.2 11 10.4 1.6 12 13.3 0.9 1 13.3 trg LEHPM1-0640 00 28 54.8 −27 33 34 24.8 8.3 11 ... ... ... ... ... ... 24.8 plt LTT17138 00 28 57.7 −02 26 59 24.4 7.3 11 ... ... ... ... ... ... 24.4 plt LTT00266 00 29 58.7 −24 38 27 21.0 6.3 11 ... ... ... ... ... ... 21.0 plt L050-078 00 31 04.3 −72 01 06 12.4 5.9 11 15.7 2.5 12 ... ... ... 15.7 ccd GJ1013 00 31 35.4 −05 52 13 16.1 4.5 11 16.6 2.6 12 16.1 1.1 1 16.1 trg GR*0050 00 32 53.2 −04 34 07 11.5 3.4 11 11.7 2.0 12 ... ... ... 11.7 ccd

– 72 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L291-115 00 33 13.5 −47 33 17 17.7 5.3 11 ... ... ... ... ... ... 17.7 plt LHS1099 00 34 07.5 −23 03 19 25.0 7.9 11 ... ... ... ... ... ... 25.0 plt LTT00307 00 34 39.0 −02 25 00 16.2 5.1 11 20.7 3.4 12 ... ... ... 20.7 ccd LTT00313 00 35 38.1 −10 04 19 13.9 3.8 11 17.5 2.7 12 ... ... ... 17.5 ccd LP645-053 00 35 44.1 −05 41 11 16.8 6.2 11 ... ... ... ... ... ... 16.8 plt LP881-239 00 37 35.8 −27 08 31 22.0 6.6 11 23.0 3.6 12 ... ... ... 23.0 ccd LTT00338 00 38 33.4 −11 16 03 25.0 7.7 11 ... ... ... ... ... ... 25.0 plt GJ0027.1 00 39 58.8 −44 15 12 18.3 5.3 11 20.7 3.3 12 24.4 1.6 2 24.4 trg LTT00349 00 39 59.4 −12 11 43 22.0 5.9 11 ... ... ... ... ... ... 22.0 plt GJ1016 00 41 30.5 −33 37 32 15.9 4.7 8 20.0 3.2 9 19.5 0.9 1 19.5 trg LHS1134 00 43 26.0 −41 17 34 10.5 3.0 11 10.9 1.7 12 ... ... ... 10.9 ccd LEHPM1-0927 00 44 38.0 −78 45 09 18.2 6.4 11 ... ... ... ... ... ... 18.2 plt LHS1140 00 44 59.3 −15 16 18 23.2 9.4 11 17.2 2.9 12 ... ... ... 17.2 ccd LP989-200 00 46 16.3 −40 17 54 22.8 6.2 11 ... ... ... ... ... ... 22.8 plt LP646-016 00 47 18.0 −06 28 38 23.6 7.0 11 ... ... ... ... ... ... 23.6 plt LTT00453 00 48 13.4 −05 08 08 19.8 6.4 11 ... ... ... 23.8 2.1 1 23.8 trg LTT00464 00 49 01.7 −50 08 42 15.3 4.6 9 19.2 3.1 10 21.6 1.0 1 21.6 trg GJ1022 00 49 29.1 −61 02 33 19.6 5.3 11 21.1 3.3 12 20.6 2.7 1 20.6 trg LTT00534 00 56 50.4 −11 35 20 19.4 5.5 5 23.8 3.9 9 24.8 1.7 1 24.8 trg L087-002 00 57 12.5 −64 15 24 12.7 3.5 11 13.6 2.1 12 ... ... ... 13.6 ccd GJ0046 00 58 27.9 −27 51 25 6.6 2.1 11 9.7 1.5 12 12.4 0.5 2 12.4 trg LTT00556 00 58 52.8 −28 13 52 19.3 7.4 11 ... ... ... ... ... ... 19.3 plt GJ1025 01 00 56.1 −04 26 57 15.9 4.3 11 15.2 2.5 12 11.4 0.2 1 11.4 trg LEP0100-7904 01 00 56.4 −79 04 25 14.9 4.3 11 18.8 3.1 12 ... ... ... 18.8 ccd LTT00573 01 01 24.7 −01 05 59 16.0 4.3 11 17.7 3.1 12 ... ... ... 17.7 ccd L171-012 01 01 57.9 −55 23 46 23.2 6.4 11 ... ... ... ... ... ... 23.2 plt LHS0132 01 02 51.1 −37 37 44 9.8 3.0 11 10.4 1.6 12 12.2 0.4 1 12.2 trg LEHPM1-1188 01 03 12.0 −53 51 43 23.8 8.6 11 ... ... ... ... ... ... 23.8 plt LTT00597 01 03 54.8 −26 20 05 22.1 5.9 11 ... ... ... ... ... ... 22.1 plt L087-010 01 04 07.0 −65 22 27 14.9 4.2 11 14.7 2.5 12 ... ... ... 14.7 ccd G269-089 01 04 28.9 −38 27 49 15.7 4.3 11 ... ... ... ... ... ... 15.7 plt GJ1028 01 04 53.8 −18 07 29 12.0 3.5 11 10.3 1.6 12 10.0 0.5 1 10.0 trg LTT00622 01 06 27.1 −02 10 35 24.9 7.0 11 ... ... ... ... ... ... 24.9 plt GJ1031 01 08 18.3 −28 48 21 15.4 4.2 11 ... ... ... ... ... ... 15.4 plt G271-001 01 08 50.4 −03 40 34 20.0 5.6 11 ... ... ... ... ... ... 20.0 plt SSS0109-5101 01 09 01.5 −51 00 50 15.0 4.3 11 15.0 2.7 9 ... ... ... 15.0 ccd GJ1032 01 09 12.5 −24 41 21 14.8 4.1 11 15.4 2.4 12 22.6 1.6 1 22.6 trg GJ2021 01 09 18.7 −24 30 24 18.6 5.2 11 ... ... ... ... ... ... 18.6 plt LP647-013 01 09 51.2 −03 43 26 9.3 4.3 11 11.4 2.1 12 9.6 0.2 1 9.6 trg LP707-016 01 10 17.5 −11 51 18 17.3 5.5 11 12.6 2.1 12 ... ... ... 12.6 ccd GJ0054 01 10 22.9 −67 26 42 [3.6] 1.6 10 [4.9] 0.8 12 7.8 0.1 3 7.8 trg SCR0111-4908 01 11 47.5 −49 08 09 23.6 10.8 11 17.5 2.8 12 ... ... ... 17.5 ccd GJ0054.1 01 12 30.7 −16 59 56 6.0 1.7 11 4.7 0.8 12 3.7 0.0 2 3.7 trg LEHPM1-1343 01 13 16.4 −54 29 14 14.6 4.3 11 15.2 2.3 12 ... ... ... 15.2 ccd SCR0113-7603 01 13 31.5 −76 03 09 21.7 8.0 11 22.8 3.6 12 ... ... ... 22.8 ccd LHS1217 01 14 08.6 −36 56 43 18.3 6.2 11 ... ... ... ... ... ... 18.3 plt L221-060 01 14 34.2 −53 56 32 13.1 3.5 11 16.1 2.6 12 16.6 0.5 1 16.6 trg

– 73 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP938-144 01 14 36.7 −34 34 51 23.8 8.8 11 ... ... ... ... ... ... 23.8 plt LP938-149 01 15 29.8 −33 25 52 24.0 7.5 11 ... ... ... ... ... ... 24.0 plt GJ1036 01 17 15.4 −35 42 57 11.0 3.7 11 14.0 2.3 12 16.2 0.9 1 16.2 trg L797-030 01 17 15.7 −13 15 48 15.9 4.7 8 17.8 2.9 12 23.4 1.4 1 23.4 trg GJ0056.1 01 18 16.0 −12 53 59 19.9 5.6 11 19.2 3.0 12 22.1 1.6 2 22.1 trg LTT00734 01 19 51.1 −27 26 39 21.9 6.2 11 ... ... ... ... ... ... 21.9 plt GJ0057 01 21 34.6 −41 39 23 12.6 3.7 11 18.2 2.9 9 16.7 0.4 2 16.7 trg LTT00755 01 22 23.1 −33 12 51 14.8 5.4 10 ... ... ... 24.6 1.1 1 24.6 trg L797-023 01 23 18.0 −12 56 23 24.4 6.7 11 22.2 3.5 12 ... ... ... 22.2 ccd LTT00774 01 23 24.8 −30 45 34 18.6 6.4 11 ... ... ... ... ... ... 18.6 plt SCR0124-0027 01 24 31.3 −00 27 56 27.6 8.2 11 21.6 3.4 12 ... ... ... 21.6 ccd LEHPM1-1550 01 26 43.1 −54 43 30 20.7 6.9 11 ... ... ... ... ... ... 20.7 plt L002-060 01 29 20.9 −85 56 11 12.3 3.7 11 12.2 2.0 12 ... ... ... 12.2 ccd LTT00818 01 30 05.1 −25 45 08 20.3 5.6 11 ... ... ... ... ... ... 20.3 plt LHS0142 01 32 26.2 −21 54 19 16.9 4.7 11 17.7 2.9 12 18.1 0.6 2 18.1 trg LP768-113 01 33 58.0 −17 38 24 18.7 5.4 11 14.0 2.2 12 ... ... ... 14.0 ccd SCR0135-6127 01 35 53.7 −61 27 11 29.9 7.9 11 24.9 3.9 12 ... ... ... 24.9 ccd LP883-537 01 36 08.7 −26 52 16 19.1 5.1 11 19.6 3.1 12 ... ... ... 19.6 ccd LP648-020 01 36 55.2 −06 47 38 23.9 7.5 11 ... ... ... ... ... ... 23.9 plt LHS1268 01 37 20.8 −49 11 44 12.9 3.9 11 16.6 2.8 10 22.5 0.8 2 22.5 trg SCR0137-4148 01 37 23.5 −41 48 56 21.9 6.3 11 24.1 3.8 12 ... ... ... 24.1 ccd SCR0138-6029 01 38 01.1 −60 29 56 28.7 10.2 11 20.3 3.2 12 ... ... ... 20.3 ccd GJ0065 01 39 01.5 −17 57 02 [2.7] 1.0 11 [1.8] 0.3 12 2.7 0.0 1 2.7 trg L294-078 01 39 11.5 −48 17 50 20.5 5.7 11 ... ... ... ... ... ... 20.5 plt LP991-084 01 39 21.7 −39 36 09 9.2 2.8 11 8.5 1.3 12 ... ... ... 8.5 ccd SCR0139-5927 01 39 39.8 −59 27 56 17.4 5.2 11 ... ... ... ... ... ... 17.4 plt WT0050 01 46 29.4 −53 39 33 13.5 3.9 11 13.7 2.3 12 ... ... ... 13.7 ccd L870-044 01 46 36.8 −08 38 58 15.5 5.1 11 14.6 2.2 12 ... ... ... 14.6 ccd L294-092 01 47 42.6 −48 36 06 9.9 2.8 11 11.5 1.8 12 ... ... ... 11.5 ccd L173-039 01 48 26.0 −56 58 42 11.6 3.2 11 15.5 2.6 12 ... ... ... 15.5 ccd L052-022 01 48 26.2 −70 58 29 24.0 7.6 8 ... ... ... ... ... ... 24.0 plt SCR0149-8038 01 49 42.7 −80 38 28 25.3 9.6 11 23.8 3.8 12 ... ... ... 23.8 ccd LP940-020 01 49 43.5 −33 19 20 25.0 7.2 11 ... ... ... ... ... ... 25.0 plt LP940-021 01 50 13.3 −37 41 52 21.6 6.0 11 22.7 3.5 12 ... ... ... 22.7 ccd LHS1300 01 50 20.1 −49 36 40 24.3 6.9 11 ... ... ... ... ... ... 24.3 plt LHS5043 01 50 53.3 −34 24 39 24.3 7.5 11 ... ... ... ... ... ... 24.3 plt LHS1302 01 51 04.1 −06 07 05 16.5 6.5 11 11.0 1.9 12 9.9 0.2 1 9.9 trg GJ0078 01 51 48.7 −10 48 13 18.7 5.5 11 20.8 3.2 12 16.2 0.7 2 16.2 trg GJ0079 01 52 49.2 −22 26 06 6.6 1.8 11 8.9 1.5 10 11.0 0.1 2 11.0 trg LHS5045 01 52 51.6 −48 05 41 11.5 3.3 11 12.1 1.9 12 ... ... ... 12.1 ccd LTT01010 01 53 11.4 −21 05 43 15.3 4.2 11 16.0 2.7 12 ... ... ... 16.0 ccd L088-043 01 53 37.1 −66 53 34 12.1 3.3 11 11.6 1.9 12 ... ... ... 11.6 ccd LHS1311 01 53 50.6 −10 32 14 22.0 7.3 11 19.4 3.1 12 ... ... ... 19.4 ccd LP768-670 01 54 08.0 −15 36 22 21.7 6.6 11 16.3 2.5 12 ... ... ... 16.3 ccd L223-077 01 55 13.2 −53 06 31 21.2 6.4 11 ... ... ... ... ... ... 21.2 plt LHS1325 02 00 47.3 −10 21 21 24.1 6.5 11 ... ... ... ... ... ... 24.1 plt LP709-018 02 01 43.9 −10 17 29 21.7 6.1 11 ... ... ... ... ... ... 21.7 plt

– 74 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L655-017 02 03 20.8 −21 13 43 13.9 4.6 8 12.0 1.9 12 ... ... ... 12.0 ccd LHS1332 02 04 27.5 −01 52 57 21.7 5.9 11 21.9 3.6 12 ... ... ... 21.9 ccd GJ0084 02 05 04.9 −17 36 53 [8.1] 2.5 9 [6.8] 1.1 12 9.1 0.2 2 9.1 trg GJ0084.1 02 05 23.7 −28 04 11 16.1 4.5 11 21.8 3.5 10 23.1 1.1 2 23.1 trg LHS1339 02 05 48.6 −30 10 36 14.0 3.7 11 15.7 2.6 12 9.3 0.3 1 9.3 trg GJ0085 02 07 23.3 −66 34 12 18.3 5.0 11 19.2 3.0 12 ... ... ... 19.2 ccd LHS1347 02 09 36.1 −14 21 33 17.4 5.1 11 13.9 2.3 12 19.7 1.0 2 19.7 trg LP709-043 02 10 03.7 −08 53 00 17.2 4.5 11 15.6 2.5 12 ... ... ... 15.6 ccd SCR0210-6622 02 10 45.1 −66 22 27 30.0 9.5 11 23.3 3.6 12 ... ... ... 23.3 ccd LHS1351 02 11 18.0 −63 13 41 18.9 5.0 11 18.0 2.8 12 14.0 0.3 1 14.0 trg LHS1354 02 12 29.2 −08 04 10 [19.8] 7.0 11 [22.9] 3.9 12 ... ... ... [22.9] ccd LHS1356 02 12 58.8 −73 45 50 21.9 5.8 11 ... ... ... ... ... ... 21.9 plt L296-105 02 13 53.0 −49 23 14 21.4 5.6 11 ... ... ... ... ... ... 21.4 plt GJ0091 02 13 53.6 −32 02 29 9.4 2.7 11 10.1 1.6 12 12.5 0.3 2 12.5 trg LHS1363 02 14 12.6 −03 57 44 15.7 5.4 11 11.0 1.7 12 ... ... ... 11.0 ccd NLTT07418 02 14 18.6 −30 33 47 17.4 5.2 11 ... ... ... ... ... ... 17.4 plt LHS1367 02 15 08.1 −30 40 01 12.7 3.5 11 13.1 2.1 11 ... ... ... 13.1 ccd StKM1-249 02 15 20.0 −13 00 58 21.8 6.1 11 ... ... ... ... ... ... 21.8 plt LHS1373 02 15 48.9 −12 40 27 18.6 5.0 11 18.0 2.9 12 ... ... ... 18.0 ccd LP829-041 02 16 21.4 −22 00 49 25.0 9.3 11 ... ... ... ... ... ... 25.0 plt SCR0216-5257 02 16 32.0 −52 57 47 25.6 7.3 11 22.8 3.8 12 ... ... ... 22.8 ccd LHS1377 02 16 41.2 −30 59 18 11.8 3.7 11 10.4 1.7 12 14.3 0.6 1 14.3 trg WT0084 02 17 28.5 −59 22 44 19.1 9.8 11 15.8 2.6 12 13.1 0.5 1 13.1 trg GJ0093 02 17 34.2 −53 59 20 22.7 6.4 11 27.0 4.2 10 22.5 1.3 2 22.5 trg L174-034 02 18 17.9 −55 07 33 22.5 6.0 11 ... ... ... ... ... ... 22.5 plt GJ1046 02 19 10.1 −36 46 41 [13.1] 3.4 11 [13.0] 2.1 12 14.1 0.6 1 14.1 trg LP710-008 02 22 17.8 −13 11 06 23.8 6.5 11 ... ... ... ... ... ... 23.8 plt LP941-057 02 22 18.3 −36 51 52 23.9 7.1 11 ... ... ... ... ... ... 23.9 plt L440-002 02 22 25.6 −34 33 18 21.2 5.8 11 ... ... ... ... ... ... 21.2 plt LP829-051 02 23 24.0 −23 18 25 21.9 7.6 11 20.8 3.2 12 ... ... ... 20.8 ccd L296-061 02 24 26.6 −47 10 24 19.7 5.6 11 ... ... ... ... ... ... 19.7 plt LP885-059 02 26 32.8 −29 30 56 24.8 7.3 11 ... ... ... ... ... ... 24.8 plt L513-008 02 27 30.4 −30 54 36 15.6 4.5 9 17.0 2.7 12 20.6 0.5 1 20.6 trg LP941-090 02 28 07.7 −36 28 20 22.7 6.8 11 ... ... ... ... ... ... 22.7 plt LHS1412 02 30 34.9 −15 43 25 21.9 5.9 11 ... ... ... ... ... ... 21.9 plt LP650-158 02 31 33.3 −03 56 23 25.6 6.9 7 22.9 4.3 12 ... ... ... 22.9 ccd L225-057 02 34 21.2 −53 05 37 10.7 2.9 11 9.5 1.5 12 ... ... ... 9.5 ccd GJ0103 02 34 22.6 −43 47 47 [5.6] 2.2 9 [6.6] 1.5 12 11.6 0.1 2 11.6 trg APM0237-5928 02 36 32.5 −59 28 06 14.6 7.0 11 9.2 1.5 12 9.6 0.1 1 9.6 trg L174-028 02 37 52.8 −58 45 11 15.1 4.9 11 12.5 1.9 12 15.0 0.8 1 15.0 trg LEHPM1-2662 02 38 49.1 −39 16 37 24.4 7.0 11 ... ... ... ... ... ... 24.4 plt GJ1050 02 39 50.7 −34 07 58 14.9 4.1 11 15.1 2.4 12 10.7 0.5 1 10.7 trg G075-035 02 41 15.1 −04 32 18 16.3 5.0 11 12.2 1.9 12 ... ... ... 12.2 ccd LHS1434 02 42 56.3 −38 56 12 18.8 5.1 11 22.1 3.4 12 ... ... ... 22.1 ccd GJ1051 02 43 53.2 −08 49 46 23.3 7.4 5 26.3 4.1 12 24.8 2.4 2 24.8 trg LP993-115 02 45 14.3 −43 44 11 12.1 4.6 11 9.2 1.4 12 11.2 0.2 2 11.2 trg LP711-005 02 45 18.5 −13 56 24 24.0 6.9 11 ... ... ... ... ... ... 24.0 plt

– 75 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

SCR0246-7024 02 46 02.3 −70 24 06 20.0 8.1 11 14.2 2.3 12 ... ... ... 14.2 ccd LHS0017 02 46 14.9 −04 59 21 27.9 11.7 11 ... ... ... 16.6 2.3 1 16.6 trg LTT01349 02 46 42.9 −23 05 12 14.6 4.1 11 20.1 3.2 9 23.0 0.9 1 23.0 trg LP771-021 02 48 41.0 −16 51 22 19.0 5.2 11 19.1 3.0 12 16.2 1.4 1 16.2 trg GJ0114.1 02 50 09.8 −53 08 20 11.8 3.2 11 12.1 1.9 12 13.1 0.3 2 13.1 trg LEHPM1-2816 02 50 23.0 −21 04 45 25.0 6.9 11 ... ... ... ... ... ... 25.0 plt GJ0118 02 52 22.2 −63 40 48 12.2 3.3 11 11.6 1.8 12 11.7 0.3 2 11.7 trg LEHPM1-2855 02 52 29.3 −24 17 19 21.4 6.6 11 ... ... ... ... ... ... 21.4 plt L012-006 02 53 17.0 −80 31 20 24.0 6.5 11 24.8 3.9 12 ... ... ... 24.8 ccd NLTT09315 02 53 46.9 −61 35 19 16.5 4.4 11 ... ... ... ... ... ... 16.5 plt LP831-001 02 54 39.5 −22 15 59 20.1 5.8 11 ... ... ... ... ... ... 20.1 plt LHS1471 02 55 14.5 −51 40 21 21.8 6.0 11 ... ... ... ... ... ... 21.8 plt LHS1481 02 58 10.2 −12 53 06 21.3 5.8 11 22.6 3.9 12 ... ... ... 22.6 ccd LTT01445 03 01 51.0 −16 35 31 [11.1] 3.7 8 6.9 1.3 12 7.0 0.1 3 7.0 trg LHS1490 03 02 06.4 −39 50 52 24.3 9.2 11 20.1 4.0 12 ... ... ... 20.1 ccd G075-060 03 02 09.8 −00 44 43 23.6 6.9 11 ... ... ... ... ... ... 23.6 plt APM0302-6952 03 02 30.8 −69 52 03 20.4 5.6 11 ... ... ... ... ... ... 20.4 plt GJ0121.1 03 02 38.1 −18 09 59 15.5 5.1 11 15.5 2.4 12 19.3 1.5 2 19.3 trg LEHPM1-3019 03 03 00.7 −55 24 53 24.4 7.2 11 ... ... ... ... ... ... 24.4 plt LP711-044 03 03 47.9 −12 51 19 17.8 5.1 11 17.7 2.8 12 ... ... ... 17.7 ccd LHS1491 03 04 04.5 −20 22 43 13.8 4.2 11 12.4 2.0 12 14.9 0.3 1 14.9 trg LEHPM1-3070 03 06 11.6 −36 47 53 13.8 5.4 11 12.8 2.0 10 13.1 0.2 1 13.1 trg GJ1054 03 07 55.8 −28 13 11 [11.4] 3.0 2 [13.7] 2.6 12 18.0 0.8 1 18.0 trg LP994-114 03 09 22.2 −39 11 03 18.4 5.7 11 ... ... ... ... ... ... 18.4 plt LP831-035 03 10 03.1 −23 41 31 21.3 6.3 11 ... ... ... ... ... ... 21.3 plt LTT01505 03 11 36.7 −04 16 37 24.7 7.4 11 19.5 3.1 12 ... ... ... 19.5 ccd GJ0130 03 12 29.8 −38 05 20 13.3 3.5 7 16.7 2.7 12 12.6 1.6 1 12.6 trg LP831-045 03 14 18.2 −23 09 30 14.8 3.9 11 12.8 2.0 12 ... ... ... 12.8 ccd StKM1-350 03 14 36.7 −09 40 03 21.9 5.9 8 24.6 3.9 12 ... ... ... 24.6 ccd LP831-068 03 16 47.8 −21 25 26 12.1 3.7 11 12.6 2.1 12 ... ... ... 12.6 ccd LP994-091 03 17 03.0 −42 14 33 24.3 7.2 11 ... ... ... ... ... ... 24.3 plt LP887-070 03 18 04.0 −30 24 12 16.3 5.2 8 19.7 3.2 12 23.0 1.4 1 23.0 trg LP994-096 03 18 45.5 −40 51 34 13.6 4.1 11 13.9 2.2 12 ... ... ... 13.9 ccd LTT01577 03 18 58.3 −36 23 35 19.1 5.7 8 15.4 2.4 12 20.2 1.3 1 20.2 trg LTT01578 03 19 29.2 −30 59 44 21.0 7.8 11 18.4 2.8 12 ... ... ... 18.4 ccd 2MA0320-0446 03 20 28.4 −04 46 37 19.1 10.7 6 23.4 4.0 11 ... ... ... 23.4 ccd L127-124 03 20 51.8 −63 51 53 17.7 6.8 11 ... ... ... ... ... ... 17.7 plt DEN0320-5520 03 20 58.9 −55 20 16 24.5 7.4 11 ... ... ... ... ... ... 24.5 plt LTT17505 03 21 46.9 −06 40 24 11.4 3.2 11 14.5 2.3 12 ... ... ... 14.5 ccd LP832-007 03 23 06.7 −24 13 28 23.5 6.5 11 ... ... ... ... ... ... 23.5 plt DEN0324-7727 03 24 26.9 −77 27 05 20.8 6.0 11 ... ... ... ... ... ... 20.8 plt LTT01628 03 25 39.7 −42 59 12 20.4 5.6 11 24.8 3.9 9 23.3 1.2 1 23.3 trg SCR0327-3634 03 27 46.8 −36 34 40 20.2 6.0 11 18.8 3.0 12 ... ... ... 18.8 ccd L055-011 03 28 08.4 −70 01 41 23.6 6.4 11 ... ... ... ... ... ... 23.6 plt GJ0143.1 03 29 19.8 −11 40 42 13.6 4.0 3 17.7 2.9 9 22.0 1.0 2 22.0 trg LP888-018 03 31 30.3 −30 42 39 12.1 3.6 11 11.3 1.8 11 ... ... ... 11.3 ccd GJ0145 03 32 55.8 −44 42 07 13.5 4.0 11 12.0 1.9 12 10.8 0.2 2 10.8 trg

– 76 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LEHPM1-3396 03 34 12.2 −49 53 32 10.9 3.1 11 10.7 1.9 9 8.3 0.3 1 8.3 trg LHS0176 03 35 38.6 −08 29 23 17.6 7.6 11 13.1 2.1 12 12.9 0.2 1 12.9 trg GJ1061 03 35 59.7 −44 30 45 6.2 2.8 11 3.6 0.6 12 3.7 0.0 2 3.7 trg LHS1567 03 36 06.7 −40 59 54 22.6 6.9 11 ... ... ... ... ... ... 22.6 plt LEHPM1-3427 03 36 47.6 −55 45 08 22.8 6.9 11 ... ... ... ... ... ... 22.8 plt LHS1572 03 38 10.0 −68 56 46 [13.9] 3.8 11 [14.5] 2.2 12 ... ... ... [14.5] ccd GJ1062 03 38 15.7 −11 29 14 33.2 9.6 11 37.0 6.0 12 16.0 0.9 1 16.0 trg L228-092 03 38 55.9 −52 34 11 16.5 5.1 11 ... ... ... ... ... ... 16.5 plt LP944-020 03 39 35.3 −35 25 44 6.4 2.0 10 7.0 1.3 11 6.3 0.0 2 6.3 trg NLTT11616 03 40 08.9 −60 35 59 22.8 6.0 11 ... ... ... ... ... ... 22.8 plt SCR0342-6407 03 42 57.4 −64 07 57 39.3 15.5 11 37.9 8.6 12 24.1 1.2 1 24.1 trg LHS1582 03 43 22.1 −09 33 51 [16.7] 5.3 11 [13.3] 2.3 12 21.7 0.8 1 21.7 trg LP944-038 03 44 47.9 −38 20 13 [19.0] 5.1 11 ... ... ... ... ... ... [19.0] plt LHS1590 03 46 45.4 −11 17 42 25.0 6.7 11 22.0 3.4 12 ... ... ... 22.0 ccd G080-021 03 47 23.4 −01 58 20 12.4 3.3 11 11.9 1.9 12 16.0 0.5 2 16.0 trg LEHPM1-3548 03 50 05.5 −39 22 32 22.9 6.6 11 ... ... ... ... ... ... 22.9 plt GJ1065 03 50 44.3 −06 05 42 16.2 4.9 11 12.6 2.0 12 9.5 0.3 1 9.5 trg LHS1604 03 51 00.0 −00 52 45 14.4 4.0 11 12.4 1.9 12 14.7 0.4 1 14.7 trg LP833-014 03 52 23.1 −22 52 56 [16.0] 4.4 11 [18.1] 2.8 12 24.4 2.9 1 24.4 trg LEHPM1-3582 03 57 49.1 −37 54 04 17.3 5.2 11 ... ... ... ... ... ... 17.3 plt LP833-023 04 00 28.6 −25 52 52 22.2 6.2 11 ... ... ... ... ... ... 22.2 plt LHS1630 04 07 20.5 −24 29 14 [12.6] 3.4 11 [11.7] 1.8 12 17.8 0.3 1 17.8 trg LP889-037 04 08 55.6 −31 28 54 17.5 5.4 11 14.0 2.2 12 ... ... ... 14.0 ccd GJ0163 04 09 15.7 −53 22 25 13.6 3.8 11 12.0 1.9 12 15.0 0.4 2 15.0 trg GJ1068 04 10 28.1 −53 36 08 13.0 4.0 7 9.4 1.6 12 7.0 0.1 1 7.0 trg LP714-037 04 10 48.1 −12 51 43 23.5 9.4 11 ... ... ... ... ... ... 23.5 plt LHS1641 04 12 43.1 −22 50 39 22.5 6.1 11 ... ... ... ... ... ... 22.5 plt LHS1639 04 12 47.5 −53 52 04 20.7 5.8 11 ... ... ... ... ... ... 20.7 plt G160-054 04 13 45.9 −05 09 05 23.4 8.0 11 17.0 2.6 12 ... ... ... 17.0 ccd GJ2033 04 16 41.7 −12 33 23 [11.8] 3.2 11 [13.9] 2.2 12 21.4 2.0 1 21.4 trg LEHPM1-3719 04 17 34.6 −48 34 39 18.9 9.2 11 ... ... ... ... ... ... 18.9 plt LHS1654 04 18 04.7 −49 01 30 24.9 7.3 11 ... ... ... ... ... ... 24.9 plt NLTT12979 04 18 06.5 −24 06 24 25.0 7.7 11 ... ... ... ... ... ... 25.0 plt NLTT12997 04 18 40.1 −25 07 09 21.7 6.2 11 ... ... ... ... ... ... 21.7 plt SCR0420-7005 04 20 12.6 −70 05 59 22.5 9.2 11 16.3 2.7 12 ... ... ... 16.3 ccd LHS1665 04 22 12.5 −57 26 01 15.8 4.5 11 ... ... ... ... ... ... 15.8 plt LHS1668 04 24 56.2 −40 02 48 19.3 6.3 11 15.8 2.8 12 ... ... ... 15.8 ccd LHS0189 04 25 38.4 −06 52 37 {[70.0]} 22.9 4 {[83.1]} 24.9 8 18.4 1.0 2 18.4 trg LHS5094 04 26 32.6 −30 48 02 13.8 4.1 11 11.5 1.9 12 ... ... ... 11.5 ccd LEHPM2-1698 04 27 05.8 −40 26 40 23.2 6.7 11 ... ... ... ... ... ... 23.2 plt L178-101 04 27 36.2 −59 21 16 20.2 5.3 11 ... ... ... ... ... ... 20.2 plt L130-037 04 28 05.7 −62 09 25 14.4 4.0 11 14.9 2.4 12 ... ... ... 14.9 ccd LP715-051 04 31 09.0 −13 30 53 [12.3] 3.3 11 [13.4] 2.2 12 19.1 1.3 1 19.1 trg SCR0433-0211 04 33 31.5 −02 11 01 29.6 10.7 11 21.8 3.8 12 ... ... ... 21.8 ccd L231-032 04 33 39.7 −51 57 22 23.5 6.3 11 ... ... ... ... ... ... 23.5 plt LP775-031 04 35 16.1 −16 06 57 8.6 3.5 11 7.7 1.2 11 10.5 0.1 1 10.5 trg LP834-032 04 35 36.2 −25 27 35 13.0 4.0 11 10.8 1.7 12 ... ... ... 10.8 ccd

– 77 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L951-054 04 36 26.8 −03 43 56 21.8 6.3 11 ... ... ... ... ... ... 21.8 plt L591-042 04 36 40.9 −27 21 18 18.1 4.9 11 17.9 2.8 12 ... ... ... 17.9 ccd GJ0173 04 37 41.9 −11 02 20 8.2 2.1 11 9.9 1.6 12 11.1 0.2 2 11.1 trg LP655-043 04 38 02.5 −05 56 13 16.8 5.8 11 14.7 2.3 12 ... ... ... 14.7 ccd LP715-039 04 38 37.2 −11 30 15 14.0 3.9 11 14.9 2.3 12 ... ... ... 14.9 ccd LP655-048 04 40 23.3 −05 30 08 8.9 2.7 11 8.5 1.3 12 9.8 0.1 1 9.8 trg LP891-006 04 43 11.8 −32 26 42 24.6 6.8 11 ... ... ... ... ... ... 24.6 plt UPM0444-3749 04 44 50.2 −37 49 41 24.7 7.4 11 20.7 3.3 12 ... ... ... 20.7 ccd LP656-009 04 46 24.4 −02 49 08 23.2 6.3 11 24.9 3.9 12 ... ... ... 24.9 ccd LP835-018 04 48 01.0 −26 03 01 25.0 8.0 11 ... ... ... ... ... ... 25.0 plt L736-001 04 49 32.8 −14 47 23 16.0 4.2 2 ... ... ... 24.8 1.4 1 24.8 trg APM0452-5819 04 51 37.3 −58 18 52 18.1 5.3 11 15.7 2.4 12 17.2 0.4 1 17.2 trg LP716-010 04 52 04.0 −10 58 22 15.3 4.5 11 12.9 2.0 12 ... ... ... 12.9 ccd LP776-025 04 52 24.4 −16 49 22 12.1 4.9 4 10.4 1.6 12 ... ... ... 10.4 ccd GJ0180 04 53 50.0 −17 46 24 9.7 2.7 11 11.9 1.9 12 12.1 0.3 2 12.1 trg G084-025 04 57 58.6 −05 06 17 23.4 8.4 11 ... ... ... ... ... ... 23.4 plt LP891-046 04 59 24.4 −30 55 58 22.8 8.7 11 18.7 3.0 12 ... ... ... 18.7 ccd NLTT14380 04 59 32.3 −61 53 04 16.1 4.3 11 ... ... ... ... ... ... 16.1 plt LHS1723 05 01 57.4 −06 56 47 8.3 2.5 11 6.4 1.1 12 5.3 0.0 1 5.3 trg GJ0185 05 02 28.4 −21 15 24 [5.4] 1.5 11 [6.9] 1.1 9 8.3 0.1 2 8.3 trg LHS1731 05 03 20.1 −17 22 25 11.2 4.9 8 10.5 1.7 12 9.2 0.1 2 9.2 trg LP716-035 05 05 11.8 −12 00 29 21.1 5.9 11 22.1 6.5 12 ... ... ... 22.1 ccd NLTT14654 05 08 09.1 −73 26 50 22.7 10.8 10 ... ... ... ... ... ... 22.7 plt GJ0190 05 08 35.1 −18 10 19 [6.0] 1.8 11 [4.3] 0.7 12 9.3 0.2 2 9.3 trg LP717-003 05 09 19.4 −13 48 41 22.2 6.7 11 ... ... ... ... ... ... 22.2 plt SCR0509-4325 05 09 43.9 −43 25 17 18.0 5.2 11 16.4 2.6 12 ... ... ... 16.4 ccd GJ0191 05 11 40.6 −45 01 06 6.3 1.8 11 7.9 1.2 9 3.9 0.0 2 3.9 trg WT2419 05 11 44.6 −36 12 31 24.1 7.1 11 ... ... ... ... ... ... 24.1 plt NLTT14823 05 13 06.0 −76 53 22 16.2 8.6 11 22.6 3.6 12 ... ... ... 22.6 ccd LTT02208 05 13 47.3 −31 19 34 23.5 6.6 11 24.8 3.8 12 ... ... ... 24.8 ccd G084-040 05 13 50.8 −01 03 07 24.0 8.2 8 ... ... ... ... ... ... 24.0 plt L521-011 05 14 53.6 −33 04 30 16.1 5.3 11 15.4 2.6 12 ... ... ... 15.4 ccd LHS1747 05 15 08.1 −07 20 49 20.4 5.7 11 22.0 3.5 12 22.5 2.1 1 22.5 trg LHS1748 05 15 46.7 −31 17 45 17.1 4.5 11 19.9 3.1 12 23.2 0.8 1 23.2 trg LHS1749 05 16 00.4 −72 14 13 [8.6] 5.0 11 [16.3] 2.6 12 21.7 0.7 2 21.7 trg GJ1077 05 16 59.7 −78 17 20 12.0 3.2 11 12.3 2.0 12 15.2 0.4 2 15.2 trg SCR0517-4252 05 17 21.4 −42 52 47 16.6 4.9 11 16.3 2.6 12 ... ... ... 16.3 ccd L449-001 05 17 22.9 −35 21 55 [6.6] 1.8 11 [7.0] 1.1 12 11.9 0.2 1 11.9 trg 2MA0517-3349 05 17 37.7 −33 49 03 12.4 5.4 11 13.7 2.2 12 ... ... ... 13.7 ccd LP892-032 05 18 36.6 −28 42 07 24.2 7.9 11 ... ... ... ... ... ... 24.2 plt LP717-036 05 25 41.7 −09 09 13 [12.8] 3.5 11 [12.6] 1.9 12 ... ... ... [12.6] ccd L233-036 05 25 48.6 −51 19 16 20.0 5.6 11 ... ... ... ... ... ... 20.0 plt CD 42-01943 05 26 36.0 −42 20 18 [15.4] 4.8 8 ... ... ... ... ... ... [15.4] plt L306-062 05 26 40.8 −48 51 47 20.1 5.3 11 20.7 3.3 12 ... ... ... 20.7 ccd LEHPM2-1009 05 27 30.6 −51 29 16 16.0 4.9 11 ... ... ... ... ... ... 16.0 plt GJ0204.2 05 29 52.0 −03 26 30 15.7 4.4 11 14.8 2.3 12 17.6 2.0 1 17.6 trg LTT02295 05 30 18.6 −53 58 48 14.2 4.1 11 ... ... ... ... ... ... 14.2 plt

– 78 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L234-022 05 30 57.2 −53 30 52 16.6 4.6 11 ... ... ... ... ... ... 16.6 plt LHS1767 05 31 04.3 −30 11 45 17.5 4.7 11 17.3 2.7 12 15.3 0.4 1 15.3 trg GJ0205 05 31 27.4 −03 40 38 3.8 1.1 11 4.8 1.1 12 5.7 0.0 2 5.7 trg LP718-005 05 35 21.3 −09 31 07 19.9 6.0 11 ... ... ... ... ... ... 19.9 plt LHS5109 05 36 00.1 −07 38 59 12.5 3.5 11 10.0 1.6 12 ... ... ... 10.0 ccd LP658-106 05 37 23.3 −08 16 06 24.8 8.1 11 ... ... ... ... ... ... 24.8 plt WT0178 05 37 39.8 −61 54 44 22.9 7.5 11 18.4 2.9 12 16.1 0.2 1 16.1 trg L378-006 05 40 02.6 −40 11 14 23.8 6.8 11 ... ... ... ... ... ... 23.8 plt GJ2045 05 42 12.7 −05 27 56 16.2 7.1 11 16.1 3.2 12 12.6 0.2 4 12.6 trg LP837-016 05 43 04.6 −26 35 40 21.8 6.3 11 22.9 3.6 12 ... ... ... 22.9 ccd APM0544-4108 05 43 46.6 −41 08 08 24.3 8.1 11 19.1 3.0 12 20.7 0.3 1 20.7 trg 2MA0544-2433 05 44 11.5 −24 33 03 18.0 7.0 11 19.0 3.0 12 ... ... ... 19.0 ccd LP837-019 05 44 57.0 −21 36 56 20.8 5.6 11 18.9 2.9 12 ... ... ... 18.9 ccd LP837-020 05 44 57.9 −24 56 10 21.4 6.3 11 ... ... ... ... ... ... 21.4 plt LHS1785 05 47 09.1 −05 12 11 20.2 7.2 11 20.1 3.2 12 17.0 0.6 1 17.0 trg GJ0218 05 47 40.6 −36 19 43 13.1 3.6 11 13.2 2.1 12 14.9 0.3 2 14.9 trg WT2440 05 47 50.2 −34 19 14 20.9 5.7 11 ... ... ... ... ... ... 20.9 plt L307-012 05 48 45.2 −45 55 42 24.1 6.6 11 ... ... ... ... ... ... 24.1 plt LHS1793 05 52 29.2 −55 06 43 20.9 5.6 11 ... ... ... ... ... ... 20.9 plt L379-017 05 53 40.1 −42 41 44 23.9 6.8 11 ... ... ... ... ... ... 23.9 plt NLTT15791 05 53 55.4 −22 46 58 21.8 6.2 11 ... ... ... ... ... ... 21.8 plt LP837-053 05 55 43.2 −26 51 23 8.1 2.3 11 8.9 1.6 12 14.6 0.5 1 14.6 trg LHS5112 05 56 56.2 −46 55 54 [13.4] 3.7 11 [17.6] 3.0 10 23.7 0.6 2 23.7 trg UPM0559-5225 05 59 33.2 −52 25 05 21.3 5.7 11 21.4 3.5 12 ... ... ... 21.4 ccd LHS1807 06 02 22.6 −20 19 44 17.5 4.8 11 19.1 3.0 12 14.1 0.3 1 14.1 trg LHS1810 06 02 54.2 −09 15 04 18.9 6.3 11 ... ... ... ... ... ... 18.9 plt APCOL 06 04 52.2 −34 33 36 6.1 2.0 11 4.6 0.7 12 8.4 0.1 1 8.4 trg LP838-016 06 07 43.7 −25 44 42 13.8 3.9 11 12.4 2.0 12 11.4 0.3 1 11.4 trg LEHPM2-3528 06 07 58.1 −61 15 11 19.8 5.9 11 18.3 2.9 12 ... ... ... 18.3 ccd LHS1823 06 08 16.4 −32 16 46 16.2 4.3 11 ... ... ... ... ... ... 16.2 plt GJ0229 06 10 34.6 −21 51 53 [3.5] 1.4 8 [5.1] 0.9 12 5.8 0.0 2 5.8 trg GJ1088 06 10 52.9 −43 24 18 11.9 3.2 11 11.0 1.7 12 11.5 0.2 1 11.5 trg L308-038 06 12 36.7 −47 29 33 20.3 5.3 11 ... ... ... ... ... ... 20.3 plt SCR0613-3437 06 13 57.3 −34 37 02 [26.2] 9.4 11 [21.9] 6.2 12 ... ... ... [21.9] ccd GJ0231.3 06 19 20.8 −06 39 22 22.9 7.3 11 18.8 2.9 12 14.7 2.0 1 14.7 trg L308-057 06 21 06.7 −49 05 38 19.3 7.5 11 ... ... ... ... ... ... 19.3 plt UPM0621-6111 06 21 45.7 −61 11 13 21.8 7.2 11 22.8 3.7 12 ... ... ... 22.8 ccd SCR0622-4956 06 22 36.1 −49 56 29 28.9 10.0 11 23.4 3.6 12 ... ... ... 23.4 ccd 2MA0623-3435 06 23 08.8 −34 35 53 23.7 6.6 11 ... ... ... ... ... ... 23.7 plt GJ0234 06 29 23.5 −02 48 51 [5.7] 1.7 11 [3.1] 0.5 12 4.1 0.0 3 4.1 trg SCR0630-7643 06 30 46.6 −76 43 09 [6.9] 2.0 11 [5.5] 0.9 12 8.8 0.1 1 8.8 trg SCR0631-8811 06 31 31.0 −88 11 37 12.8 5.1 11 10.4 1.6 12 ... ... ... 10.4 ccd GJ0237 06 31 51.1 −43 32 03 [14.5] 4.0 11 [17.8] 2.9 10 23.3 0.8 2 23.3 trg LHS1852 06 32 22.0 −69 57 44 21.5 5.7 11 22.8 3.5 12 ... ... ... 22.8 ccd L032-009 06 33 43.3 −75 37 48 7.1 2.7 10 7.3 1.1 12 9.0 0.2 2 9.0 trg GJ0238 06 33 50.0 −58 31 43 12.6 3.5 11 12.0 2.0 12 16.4 0.5 2 16.4 trg LTT02591 06 34 18.6 −31 52 23 20.2 5.3 11 ... ... ... ... ... ... 20.2 plt

– 79 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

SCR0634-5403 06 34 36.9 −54 03 13 27.6 9.1 11 24.1 3.8 12 ... ... ... 24.1 ccd LP381-004 06 36 18.3 −40 00 24 12.8 5.0 10 17.7 2.9 9 19.6 0.6 1 19.6 trg LP720-031 06 38 35.3 −14 04 58 22.6 7.4 11 ... ... ... ... ... ... 22.6 plt LP780-032 06 39 37.4 −21 01 33 15.8 4.6 11 11.7 1.8 12 ... ... ... 11.7 ccd L182-007 06 39 37.6 −55 36 35 10.6 2.9 11 12.6 2.0 9 13.3 0.2 1 13.3 trg LP453-031 06 39 41.1 −36 59 03 16.7 4.9 11 15.7 2.6 12 ... ... ... 15.7 ccd LP780-023 06 40 08.6 −16 27 26 19.8 5.8 11 20.0 3.2 12 ... ... ... 20.0 ccd SCR0640-0552 06 40 14.0 −05 52 23 8.5 2.3 11 9.3 1.5 12 ... ... ... 9.3 ccd LP780-026 06 42 10.8 −15 43 15 24.6 6.5 11 ... ... ... ... ... ... 24.6 plt SCR0642-6707 06 42 27.2 −67 07 20 24.1 12.0 11 17.6 3.8 12 ... ... ... 17.6 ccd NLTT16977 06 43 29.8 −70 03 21 16.2 4.4 11 15.3 2.4 12 ... ... ... 15.3 ccd L597-018 06 43 40.7 −26 24 41 19.1 5.1 11 18.1 3.0 12 ... ... ... 18.1 ccd SCR0644-4223 06 44 32.1 −42 23 45 [18.8] 5.2 11 [17.5] 2.9 12 ... ... ... [17.5] ccd SCR0650-2135 06 50 26.6 −21 35 58 25.5 8.2 11 20.4 3.3 12 ... ... ... 20.4 ccd LHS1873 06 50 59.5 −09 10 50 25.6 9.2 8 22.5 3.5 12 ... ... ... 22.5 ccd DEN0652-2534 06 52 19.8 −25 34 50 14.9 8.2 7 17.9 3.2 12 15.7 0.2 1 15.7 trg L059-054 06 52 37.8 −73 58 16 20.7 5.6 11 ... ... ... ... ... ... 20.7 plt LP721-012 06 56 00.9 −38 24 17 24.2 6.7 11 ... ... ... ... ... ... 24.2 plt LP661-013 06 56 19.0 −08 35 46 21.0 7.8 11 18.5 2.8 12 ... ... ... 18.5 ccd LP382-056 06 57 11.7 −43 24 51 [13.5] 3.7 11 [12.0] 1.9 12 ... ... ... [12.0] ccd GJ0257 06 57 46.6 −44 17 28 [8.6] 2.5 11 [6.9] 1.1 12 8.0 0.1 2 8.0 trg WT0204 06 58 18.9 −39 32 16 23.9 7.3 11 19.7 3.1 12 ... ... ... 19.7 ccd SCR0659-5622 06 59 40.8 −56 22 47 28.0 9.1 11 24.4 4.2 12 ... ... ... 24.4 ccd WT1539 07 00 09.5 −28 47 02 15.7 5.7 10 ... ... ... ... ... ... 15.7 plt SCR0701-1437 07 01 36.6 −14 37 18 25.5 8.5 11 23.8 3.7 12 ... ... ... 23.8 ccd WT0207 07 02 36.6 −40 06 28 37.4 14.0 11 32.8 5.6 12 24.7 0.8 1 24.7 trg SCR0702-6102 07 02 50.4 −61 02 48 15.9 7.6 11 10.8 2.0 12 ... ... ... 10.8 ccd GJ0263 07 04 17.7 −10 30 32 [10.5] 2.7 3 [7.8] 1.3 12 16.1 0.8 2 16.1 trg LHS0225 07 04 45.8 −38 36 08 [22.3] 6.8 9 13.1 5.1 12 17.9 0.7 2 17.9 trg LEHPM2-0449 07 05 09.3 −80 29 50 22.0 6.8 11 ... ... ... ... ... ... 22.0 plt GJ2055 07 07 22.9 −21 27 27 12.9 4.4 10 13.3 2.1 12 17.3 0.7 1 17.3 trg ESO207-061 07 07 53.3 −49 00 50 20.7 8.2 7 23.1 4.0 9 16.4 0.8 2 16.4 trg LP840-016 07 08 07.0 −22 48 47 16.1 4.5 11 18.1 2.8 12 ... ... ... 18.1 ccd APM0710-5704 07 09 37.7 −57 03 42 17.6 6.0 11 14.3 2.4 12 ... ... ... 14.3 ccd LHS1906 07 12 54.1 −52 20 06 20.3 5.3 11 ... ... ... ... ... ... 20.3 plt SCR0713-0511 07 13 11.2 −05 11 49 13.1 4.7 10 13.5 2.1 12 ... ... ... 13.5 ccd LHS1909 07 15 49.0 −83 00 19 19.2 5.7 11 ... ... ... ... ... ... 19.2 plt SCR0717-0501 07 17 17.1 −05 01 04 15.9 5.8 8 13.1 2.2 12 ... ... ... 13.1 ccd LEHPM2-4145 07 18 14.0 −52 29 30 23.5 6.9 10 ... ... ... ... ... ... 23.5 plt NLTT17739 07 20 30.2 −40 55 33 20.6 5.6 11 ... ... ... ... ... ... 20.6 plt L136-037 07 20 52.0 −62 10 12 14.5 4.2 11 13.7 2.2 12 ... ... ... 13.7 ccd LP527-012 07 21 54.4 −31 04 37 24.9 8.1 11 ... ... ... ... ... ... 24.9 plt L136-001 07 23 20.8 −60 06 13 18.9 5.1 11 ... ... ... ... ... ... 18.9 plt SCR0723-8015 07 23 59.7 −80 15 18 19.3 5.6 11 17.0 3.1 12 ... ... ... 17.0 ccd SCR0724-3125 07 24 21.2 −31 25 58 24.5 9.5 11 16.5 2.6 12 ... ... ... 16.5 ccd L383-082 07 25 35.6 −42 38 57 21.4 5.7 11 ... ... ... ... ... ... 21.4 plt GJ1097 07 28 45.5 −03 17 53 11.2 4.1 11 9.7 1.5 12 11.6 0.3 2 11.6 trg

– 80 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

GJ2060 07 28 51.4 −30 14 49 [8.7] 2.7 11 [ 8.6] 1.5 12 15.5 0.4 2 15.5 trg LHS1922 07 30 39.3 −44 24 01 13.7 3.8 11 ... ... ... ... ... ... 13.7 plt SCR0731-4807 07 31 08.1 −48 07 33 26.1 7.6 11 21.3 3.4 12 ... ... ... 21.3 ccd SCR0733-2749 07 33 26.8 −27 49 04 26.6 11.7 11 22.6 3.7 12 ... ... ... 22.6 ccd SCR0733-4406 07 33 42.7 −44 06 13 22.3 6.7 11 18.7 2.9 12 ... ... ... 18.7 ccd LHS1932 07 36 12.0 −51 55 21 17.0 4.5 11 15.8 2.5 12 16.2 0.3 1 16.2 trg SCR0736-3024 07 36 56.7 −30 24 16 20.2 9.0 11 17.2 2.7 12 ... ... ... 17.2 ccd L528-016 07 38 09.7 −31 12 19 14.8 4.1 11 14.1 2.2 12 ... ... ... 14.1 ccd LHS1935 07 38 41.0 −21 13 28 14.8 4.0 11 11.9 1.9 12 10.6 0.4 1 10.6 trg SCR0740-4257 07 40 11.8 −42 57 40 10.0 2.9 11 7.2 1.1 12 ... ... ... 7.2 ccd L034-026 07 49 12.7 −76 42 07 12.2 3.6 11 9.2 1.4 12 10.6 0.2 1 10.6 trg GJ1103 07 51 54.7 −00 00 13 11.3 3.8 11 8.7 1.4 12 8.8 0.3 1 8.8 trg SCR0754-3809 07 54 54.8 −38 09 38 12.0 3.5 11 11.2 1.8 12 ... ... ... 11.2 ccd LHS1955 07 54 54.8 −29 20 56 [13.4] 4.3 11 [8.6] 1.4 12 13.5 0.2 1 13.5 trg LHS1957 07 56 53.9 −45 38 14 21.6 6.7 10 23.0 3.5 12 ... ... ... 23.0 ccd LHS5132 08 00 51.3 −57 30 34 23.7 6.3 11 ... ... ... ... ... ... 23.7 plt SCR0803-1939 08 03 26.9 −19 39 28 [23.8] 8.6 8 [23.9] 3.8 12 ... ... ... [23.9] ccd LHS1978 08 04 25.8 −83 13 59 21.6 5.8 11 ... ... ... ... ... ... 21.6 plt SCR0805-5912 08 05 46.2 −59 12 50 20.4 6.0 11 19.3 3.0 12 ... ... ... 19.3 ccd GJ0298 08 09 58.1 −52 58 05 11.7 3.1 11 12.4 1.9 12 16.7 0.7 2 16.7 trg GJ0300 08 12 40.9 −21 33 07 10.4 3.7 11 6.1 1.0 12 8.0 0.1 2 8.0 trg SCR0812-4504 08 12 44.3 −45 04 34 28.6 11.2 11 23.3 3.8 12 ... ... ... 23.3 ccd GJ0301 08 13 08.5 −13 55 01 [9.3] 2.6 11 [12.8] 2.1 9 19.2 0.7 2 19.2 trg L242-075 08 13 26.1 −53 17 38 17.8 5.8 11 ... ... ... ... ... ... 17.8 plt LHS1992 08 13 42.6 −76 07 49 17.7 5.0 11 14.4 2.2 12 ... ... ... 14.4 ccd LP843-016 08 14 22.6 −25 42 19 17.4 4.8 11 15.7 2.6 12 ... ... ... 15.7 ccd LP386-035 08 16 37.5 −42 12 26 24.5 6.7 11 ... ... ... ... ... ... 24.5 plt L098-059 08 18 07.6 −68 18 47 11.9 3.2 11 12.6 1.9 12 ... ... ... 12.6 ccd SCR0827-2526 08 27 07.0 −25 26 54 23.8 8.6 11 20.2 3.3 12 ... ... ... 20.2 ccd LHS2010 08 27 11.8 −44 59 21 10.6 3.8 8 8.9 1.4 12 13.7 0.3 1 13.7 trg SCR0829-3709 08 29 41.3 −37 09 35 25.1 9.7 11 19.4 3.0 12 ... ... ... 19.4 ccd LHS2024 08 31 23.5 −10 29 54 24.6 12.2 11 14.7 2.3 12 ... ... ... 14.7 ccd LHS2026 08 32 30.5 −01 34 39 27.5 11.5 11 19.8 3.5 12 19.7 0.2 1 19.7 trg GJ2070 08 34 25.9 −01 08 40 16.8 4.5 11 ... ... ... 13.6 1.8 1 13.6 trg SCR0835-3400 08 35 31.7 −34 00 37 25.9 10.9 11 22.0 3.7 12 ... ... ... 22.0 ccd SCR0837-2819 08 37 20.4 −28 19 58 24.4 8.9 11 23.1 3.8 12 ... ... ... 23.1 ccd LP844-004 08 37 33.9 −22 32 32 23.8 6.9 11 23.1 3.6 12 ... ... ... 23.1 ccd SCR0838-5855 08 38 02.2 −58 55 59 8.5 2.5 11 8.0 1.3 12 ... ... ... 8.0 ccd SCR0838-5302 08 38 13.2 −53 02 12 21.1 11.2 11 23.8 3.7 12 ... ... ... 23.8 ccd LTT03201 08 38 54.5 −09 33 59 18.7 5.1 11 17.3 3.0 12 ... ... ... 17.3 ccd SCR0840-4044 08 40 01.7 −40 44 31 28.5 9.1 11 23.3 3.7 12 ... ... ... 23.3 ccd GJ0317 08 40 59.2 −23 27 23 12.0 3.5 11 9.7 1.5 12 15.3 0.1 2 15.3 trg G114-014 08 42 23.2 −04 53 55 18.8 5.7 11 20.6 3.4 12 ... ... ... 20.6 ccd LP786-005 08 47 17.6 −20 58 20 24.8 7.7 11 ... ... ... ... ... ... 24.8 plt L388-106 08 48 23.2 −44 12 26 24.8 7.0 11 ... ... ... ... ... ... 24.8 plt LEHPM2-0870 08 48 59.1 −80 35 02 21.0 6.0 11 ... ... ... ... ... ... 21.0 plt SCR0852-6608 08 52 50.0 −66 08 47 26.3 7.7 11 25.0 4.0 12 ... ... ... 25.0 ccd

– 81 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

SCR0853-3924 08 53 28.7 −39 24 41 15.1 5.5 8 16.5 2.5 12 ... ... ... 16.5 ccd LHS2065 08 53 36.2 −03 29 32 8.7 2.9 11 8.8 1.6 12 8.5 0.1 4 8.5 trg L532-012 08 54 02.4 −30 51 37 14.7 4.4 11 12.6 2.0 12 ... ... ... 12.6 ccd GJ0326 08 54 05.3 −13 07 31 [13.9] 3.7 11 [13.0] 2.0 12 16.2 1.8 1 16.2 trg LHS2071 08 55 20.3 −23 52 15 [12.9] 3.7 11 [10.8] 1.7 12 15.9 0.4 1 15.9 trg L139-024 08 56 06.6 −61 57 44 22.6 8.1 11 ... ... ... ... ... ... 22.6 plt LP844-033 08 56 17.6 −23 26 57 22.1 8.6 11 17.6 2.9 12 23.6 1.6 1 23.6 trg LP606-030 08 58 43.3 −00 41 47 30.6 29.7 11 22.2 3.5 12 ... ... ... 22.2 ccd GJ1118 08 59 05.3 −31 13 27 19.0 5.3 11 16.9 2.6 12 17.8 0.6 1 17.8 trg 2MA0901-6526 09 01 31.7 −65 26 40 18.0 5.9 11 17.0 2.7 12 ... ... ... 17.0 ccd L063-046 09 01 39.0 −72 40 17 17.7 5.0 11 21.3 3.3 12 ... ... ... 21.3 ccd LTT03347 09 04 02.3 −25 04 10 25.0 6.7 11 ... ... ... ... ... ... 25.0 plt L244-024 09 05 17.9 −51 02 36 19.7 5.3 11 ... ... ... ... ... ... 19.7 plt SCR0905-0841 09 05 43.3 −08 41 58 25.2 7.2 11 20.8 3.3 12 ... ... ... 20.8 ccd GJ0334 09 06 45.4 −08 48 25 9.2 2.6 11 11.4 1.9 10 14.5 0.3 2 14.5 trg LHS2106 09 07 02.8 −22 08 50 18.9 7.7 11 14.5 2.4 12 15.1 0.3 1 15.1 trg SCR0907-3533 09 07 17.1 −35 33 03 27.4 8.8 11 24.6 3.9 12 ... ... ... 24.6 ccd L460-139 09 09 14.9 −39 59 32 24.8 7.0 11 ... ... ... ... ... ... 24.8 plt SCR0914-4134 09 14 17.4 −41 34 38 18.2 8.0 11 14.6 2.4 12 ... ... ... 14.6 ccd LHS6167 09 15 36.4 −10 35 47 [9.3] 3.4 11 [7.0] 1.2 12 ... ... ... [7.0] ccd L749-034 09 16 20.7 −18 37 33 12.8 3.5 11 12.1 1.9 12 ... ... ... 12.1 ccd LHS2122 09 16 26.0 −62 04 16 14.8 4.2 11 11.9 2.0 12 17.1 0.8 1 17.1 trg LTT03416 09 16 44.0 −24 47 43 23.0 6.3 11 ... ... ... ... ... ... 23.0 plt GJ1123 09 17 05.3 −77 49 23 8.2 2.4 11 7.3 1.3 12 9.0 0.2 1 9.0 trg G161-013 09 20 11.1 −01 10 17 22.8 6.4 11 ... ... ... ... ... ... 22.8 plt LEP0920-4922 09 20 26.0 −49 22 35 22.3 11.3 11 ... ... ... ... ... ... 22.3 plt SIP0921-2104 09 21 14.1 −21 04 44 17.2 8.6 11 18.8 3.7 10 ... ... ... 18.8 ccd GJ0341 09 21 37.6 −60 16 55 5.8 3.9 6 9.5 1.6 12 10.5 0.1 2 10.5 trg LP902-060 09 23 32.4 −33 32 56 24.7 8.1 11 ... ... ... ... ... ... 24.7 plt LP389-001 09 24 17.3 −40 05 45 15.7 4.3 9 ... ... ... ... ... ... 15.7 plt L822-019 09 28 41.6 −12 09 56 22.0 5.9 11 23.9 15.4 10 ... ... ... 23.9 ccd GJ0347 09 28 53.3 −07 22 16 20.4 5.6 11 17.6 2.7 12 16.4 0.8 2 16.4 trg WT1637 09 29 03.8 −24 29 04 15.0 4.5 11 ... ... ... ... ... ... 15.0 plt GJ0352 09 31 19.4 −13 29 19 [7.5] 2.7 5 [6.2] 1.0 12 10.2 0.3 2 10.2 trg LP788-001 09 31 22.3 −17 17 43 13.1 3.9 11 12.5 2.0 12 ... ... ... 12.5 ccd LP846-015 09 34 27.9 −26 43 27 15.6 4.6 11 ... ... ... ... ... ... 15.6 plt LTT03532 09 35 54.4 −33 43 51 24.0 6.4 11 ... ... ... ... ... ... 24.0 plt GJ0357 09 36 01.6 −21 39 39 9.8 4.3 11 10.6 1.7 12 9.0 0.2 2 9.0 trg SCR0939-4300 09 39 44.7 −43 00 27 24.8 6.8 11 20.5 3.2 12 ... ... ... 20.5 ccd GJ0358 09 39 46.4 −41 04 03 8.5 2.3 11 7.2 1.1 12 9.5 0.2 2 9.5 trg LTT03553 09 41 21.2 −20 34 41 20.5 5.6 11 21.1 3.6 12 ... ... ... 21.1 ccd G161-066 09 42 12.8 −07 01 46 24.5 7.6 11 ... ... ... ... ... ... 24.5 plt LHS2177 09 42 35.7 −19 14 05 17.8 5.0 11 16.3 2.5 12 15.8 0.9 1 15.8 trg GJ1128 09 42 46.4 −68 53 06 8.0 2.5 11 6.3 1.0 12 6.5 0.1 1 6.5 trg LHS5156 09 42 49.6 −63 37 56 13.3 4.9 11 9.6 1.5 12 10.5 0.1 1 10.5 trg LHS0272 09 43 46.2 −17 47 06 32.9 9.2 11 34.6 5.6 12 13.5 0.2 1 13.5 trg WT0244 09 44 23.7 −73 58 38 20.2 6.5 11 17.1 2.7 12 23.1 0.8 1 23.1 trg

– 82 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

GJ0367 09 44 29.8 −45 46 36 8.2 3.1 10 8.2 1.3 12 9.8 0.3 2 9.8 trg GJ1129 09 44 47.3 −18 12 49 13.4 4.7 11 9.2 1.4 12 10.7 0.3 1 10.7 trg G161-071 09 44 54.2 −12 20 54 10.2 4.4 11 6.3 1.0 12 ... ... ... 6.3 ccd LP462-119 09 45 40.1 −39 02 27 [18.4] 4.9 11 ... ... ... 20.2 2.0 1 20.2 trg WT2458 09 45 58.4 −32 53 30 12.1 3.9 11 10.8 1.7 12 ... ... ... 10.8 ccd LHS2186 09 46 09.3 −04 25 43 21.2 7.9 11 ... ... ... ... ... ... 21.2 plt GJ2075 09 49 27.8 −55 20 09 [12.3] 3.4 10 [13.6] 2.3 12 21.0 0.8 1 21.0 trg LTT03613 09 50 40.5 −13 48 39 17.0 5.4 11 13.1 2.1 12 ... ... ... 13.1 ccd LTT03612 09 50 48.3 −09 07 10 23.1 6.8 11 ... ... ... ... ... ... 23.1 plt GJ0369 09 51 09.6 −12 19 48 10.7 3.2 5 12.3 2.0 12 13.7 0.3 2 13.7 trg LTT03616 09 51 23.3 −17 44 24 18.7 5.1 11 17.7 2.7 12 ... ... ... 17.7 ccd GJ0372 09 53 11.8 −03 41 25 [9.4] 2.6 11 [9.1] 1.5 12 16.1 0.5 2 16.1 trg GJ1130 09 53 28.1 −31 45 08 13.6 3.8 11 17.9 3.0 9 24.1 0.9 1 24.1 trg LTT03629 09 53 30.3 −31 28 12 23.0 6.5 11 ... ... ... ... ... ... 23.0 plt LP847-048 09 55 23.9 −27 15 41 13.9 3.9 11 10.6 1.7 12 11.3 0.3 1 11.3 trg GJ0375 09 58 34.3 −46 25 30 [6.8] 2.3 11 [6.5] 1.0 12 15.4 0.4 2 15.4 trg GJ0377 10 01 10.7 −30 23 25 10.0 2.8 11 9.7 1.6 12 16.1 0.6 2 16.1 trg LP463-104 10 01 23.8 −38 50 25 18.2 5.0 11 ... ... ... ... ... ... 18.2 plt LHS5166 10 04 38.7 −33 35 10 21.9 6.3 11 19.2 3.1 12 18.3 1.9 1 18.3 trg LP903-021 10 04 50.6 −31 05 28 16.9 4.6 11 18.2 3.0 12 23.0 1.8 1 23.0 trg L319-147 10 06 08.7 −49 49 38 23.6 6.7 11 ... ... ... ... ... ... 23.6 plt LP789-023 10 06 31.9 −16 53 26 21.9 8.3 11 ... ... ... ... ... ... 21.9 plt L016-059 10 07 09.9 −82 50 16 [18.4] 5.1 11 ... ... ... ... ... ... [18.4] plt LP729-033 10 08 01.1 −14 36 27 20.3 6.1 11 ... ... ... ... ... ... 20.3 plt NLTT23623 10 10 46.8 −30 46 49 22.3 6.0 11 ... ... ... ... ... ... 22.3 plt WT1757 10 11 45.0 −24 25 34 17.3 5.1 11 ... ... ... ... ... ... 17.3 plt GJ0381 10 12 04.7 −02 41 05 [8.1] 2.2 11 [9.2] 1.4 12 12.0 0.4 2 12.0 trg GJ0382 10 12 17.7 −03 44 44 5.9 1.7 11 5.9 1.0 12 7.9 0.1 2 7.9 trg LHS2233 10 12 59.6 −35 43 59 21.1 5.6 11 22.1 3.9 12 ... ... ... 22.1 ccd GJ1132 10 14 51.8 −47 09 24 21.0 7.1 11 16.1 2.6 12 12.0 0.3 1 12.0 trg G162-037 10 16 35.7 −11 56 48 24.1 7.1 11 ... ... ... ... ... ... 24.1 plt GJ0386 10 16 46.0 −11 57 42 9.0 2.8 11 13.1 3.3 10 13.3 0.4 2 13.3 trg LP790-002 10 18 13.9 −20 28 41 11.8 3.5 11 9.5 1.5 12 ... ... ... 9.5 ccd LTT03780 10 18 35.2 −11 43 00 17.3 5.8 11 17.4 2.7 12 ... ... ... 17.4 ccd LP392-039 10 19 51.3 −41 48 46 18.6 5.1 11 20.0 3.2 12 ... ... ... 20.0 ccd WT2473 10 21 12.1 −37 05 44 18.3 5.2 11 ... ... ... ... ... ... 18.3 plt GJ0389 10 22 24.6 −60 10 38 [13.9] 4.1 2 17.3 2.9 12 19.8 0.7 2 19.8 trg NLTT24218 10 22 46.1 −66 02 26 20.1 5.9 11 ... ... ... ... ... ... 20.1 plt L142-086 10 24 07.0 −63 59 55 14.2 3.8 6 15.1 2.6 12 ... ... ... 15.1 ccd GJ0390 10 25 10.8 −10 13 43 8.5 2.4 11 10.2 1.8 12 12.3 0.3 2 12.3 trg LTT03835 10 26 38.3 −16 51 19 [21.3] 6.9 8 ... ... ... ... ... ... [21.3] plt LTT03855 10 30 50.8 −35 46 39 17.7 4.9 11 ... ... ... 24.6 1.2 1 24.6 trg LTT03538 10 31 08.5 −41 27 49 23.5 7.0 11 ... ... ... ... ... ... 23.5 plt LP904-068 10 33 39.1 −29 00 32 20.0 5.4 11 ... ... ... ... ... ... 20.0 plt LEHPM2-4342 10 34 24.7 −28 19 19 16.7 4.4 11 ... ... ... ... ... ... 16.7 plt LTT03877 10 35 01.1 −09 24 39 16.0 4.2 11 13.6 2.1 12 ... ... ... 13.6 ccd NLTT24896 10 37 41.6 −29 31 04 24.2 8.2 11 ... ... ... ... ... ... 24.2 plt

– 83 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LTT03896 10 37 45.3 −27 46 39 10.6 2.9 11 10.1 1.6 12 ... ... ... 10.1 ccd LEHPM2-2758 10 38 47.8 −86 32 44 13.2 5.2 11 14.5 2.2 12 ... ... ... 14.5 ccd GJ0399 10 39 40.6 −06 55 26 13.9 4.1 11 11.7 1.9 12 15.6 0.7 2 15.6 trg LP465-084 10 39 44.4 −37 55 14 [7.8] 2.4 11 [8.7] 1.3 12 14.0 0.5 1 14.0 trg WT0309 10 40 47.5 −44 45 53 22.4 6.4 11 ... ... ... ... ... ... 22.4 plt GJ1135 10 41 09.3 −36 53 44 [9.5] 2.6 11 [11.3] 1.9 12 16.3 0.4 1 16.3 trg LP904-051 10 41 44.0 −31 11 55 23.6 6.8 11 ... ... ... ... ... ... 23.6 plt LP848-050 10 42 41.4 −24 16 05 11.7 3.7 11 9.7 1.6 12 ... ... ... 9.7 ccd WT1827 10 43 02.8 −09 12 41 [13.5] 5.4 11 [9.7] 1.5 12 12.4 0.4 1 12.4 trg LTT03936 10 44 09.5 −26 37 44 20.7 5.7 11 ... ... ... ... ... ... 20.7 plt LP905-056 10 45 16.7 −30 48 27 12.2 3.2 11 15.0 2.3 12 14.0 0.5 1 14.0 trg LP849-006 10 45 51.8 −23 09 01 17.1 5.2 11 ... ... ... ... ... ... 17.1 plt LP905-017 10 47 11.2 −32 15 06 22.1 7.1 11 ... ... ... ... ... ... 22.1 plt LHS2310 10 47 38.7 −79 27 46 12.2 4.2 11 13.3 2.1 12 ... ... ... 13.3 ccd NLTT25431 10 48 01.0 −76 34 16 21.4 10.6 11 ... ... ... ... ... ... 21.4 plt DEN1048-3956 10 48 12.6 −39 56 07 4.0 1.2 11 4.5 0.7 10 4.0 0.0 3 4.0 trg LHS0292 10 48 14.6 −11 20 10 6.0 3.0 11 4.3 0.7 12 4.5 0.1 2 4.5 trg LHS5179 10 53 02.2 −15 05 03 22.0 7.1 11 24.3 3.8 12 ... ... ... 24.3 ccd 2MA1054-8505 10 54 11.0 −85 05 02 20.0 10.4 10 19.5 3.2 9 ... ... ... 19.5 ccd LTT04004 10 54 42.0 −07 18 33 14.2 3.9 11 12.2 1.9 12 ... ... ... 12.2 ccd LHS2328 10 55 34.5 −09 21 26 24.9 8.6 11 20.3 3.2 12 18.6 0.5 1 18.6 trg LHS2329 10 55 40.1 −52 10 15 23.1 6.2 11 ... ... ... ... ... ... 23.1 plt LP731-028 10 56 38.9 −15 52 54 11.8 3.1 11 13.4 2.1 12 ... ... ... 13.4 ccd LTT04030 10 58 34.2 −05 54 09 19.6 5.2 11 ... ... ... ... ... ... 19.6 plt LHS2335 10 58 35.1 −31 08 38 17.3 5.2 11 16.6 2.7 12 19.8 0.6 1 19.8 trg LP791-023 11 04 25.2 −17 48 09 23.4 6.7 11 ... ... ... ... ... ... 23.4 plt UPM1104-6232 11 04 33.8 −62 32 35 19.4 6.5 11 16.9 2.7 12 ... ... ... 16.9 ccd L066-047 11 04 33.5 −72 57 10 19.7 6.6 8 ... ... ... ... ... ... 19.7 plt LP849-051 11 05 06.9 −22 12 52 19.5 5.7 11 ... ... ... ... ... ... 19.5 plt LP731-047 11 06 56.9 −12 44 03 22.7 10.3 11 ... ... ... ... ... ... 22.7 plt L754-040 11 07 27.7 −19 17 30 13.3 3.6 11 16.7 2.7 10 18.7 0.6 1 18.7 trg L017-069 11 07 58.2 −83 51 23 15.4 6.9 11 22.5 3.5 12 ... ... ... 22.5 ccd GJ0413.1 11 09 31.3 −24 35 55 9.6 2.7 11 9.4 1.5 12 10.7 0.2 2 10.7 trg LHS2360 11 10 00.5 −74 36 15 12.1 5.2 11 14.9 2.8 12 ... ... ... 14.9 ccd SCR1110-3608 11 10 29.0 −36 08 25 22.3 7.1 11 23.8 3.7 12 ... ... ... 23.8 ccd GJ0422 11 16 00.2 −57 32 52 15.7 4.3 8 12.1 1.9 12 12.7 0.4 2 12.7 trg L611-120 11 16 06.8 −30 10 41 15.3 4.2 11 ... ... ... 23.2 1.1 1 23.2 trg LP850-015 11 16 18.7 −25 49 22 21.9 6.8 11 ... ... ... ... ... ... 21.9 plt GJ1144 11 16 22.2 −14 41 36 13.3 3.5 2 14.4 5.8 7 17.9 0.5 1 17.9 trg LHS2386 11 16 36.7 −44 07 50 21.5 5.9 11 ... ... ... ... ... ... 21.5 plt LHS2385 11 16 37.6 −27 57 19 19.1 5.9 11 ... ... ... ... ... ... 19.1 plt LP732-015 11 17 06.5 −11 22 25 23.5 6.7 11 ... ... ... ... ... ... 23.5 plt GJ1145 11 17 07.5 −27 48 49 11.4 3.2 11 15.2 2.6 9 17.7 0.4 1 17.7 trg LP792-053 11 19 22.8 −19 00 30 24.4 6.8 11 ... ... ... ... ... ... 24.4 plt L467-021 11 19 41.1 −36 15 20 23.3 6.7 11 ... ... ... ... ... ... 23.3 plt LP792-014 11 19 48.2 −16 32 38 25.0 9.7 11 ... ... ... ... ... ... 25.0 plt LP792-016 11 20 46.5 −19 39 07 20.0 5.2 11 20.4 3.2 12 ... ... ... 20.4 ccd

– 84 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP792-017 11 20 59.9 −17 01 49 21.4 6.2 11 17.8 2.9 12 ... ... ... 17.8 ccd LHS2397a 11 21 49.2 −13 13 09 [13.1] 4.4 11 [13.4] 2.1 12 14.5 0.2 5 14.5 trg LHS2400 11 22 42.5 −32 05 40 25.2 8.7 11 20.4 3.4 12 22.6 1.2 1 22.6 trg LHS2401 11 23 57.3 −18 21 49 20.2 5.3 11 19.9 3.1 12 18.4 0.9 1 18.4 trg SCR1124-3900 11 24 23.2 −39 00 43 19.1 5.4 11 22.5 3.6 12 ... ... ... 22.5 ccd SCR1125-3834 11 25 37.3 −38 34 43 18.1 5.4 11 20.4 3.2 12 ... ... ... 20.4 ccd LP792-060 11 26 50.8 −18 44 59 23.4 6.6 11 20.6 4.0 12 ... ... ... 20.6 ccd LTT04244 11 30 06.9 −30 42 44 23.8 7.6 11 ... ... ... ... ... ... 23.8 plt LP672-042 11 30 41.8 −08 05 43 14.1 4.0 11 10.8 1.7 12 13.2 0.7 1 13.2 trg LHS0306 11 31 08.4 −14 57 21 16.5 6.3 11 12.1 1.9 12 11.2 0.6 2 11.2 trg GJ0431 11 31 46.5 −41 02 47 8.7 2.5 11 7.3 1.2 12 10.4 0.3 2 10.4 trg L540-090 11 32 18.4 −35 26 14 19.1 7.6 11 ... ... ... ... ... ... 19.1 plt LP792-033 11 32 19.0 −16 58 07 20.4 5.5 8 21.9 3.5 12 22.8 1.4 1 22.8 trg L324-051 11 32 22.0 −46 28 30 14.3 7.3 10 17.8 2.8 12 ... ... ... 17.8 ccd LP850-047 11 33 01.9 −23 11 08 24.3 7.6 11 ... ... ... ... ... ... 24.3 plt LHS2427 11 34 38.0 −23 52 15 15.3 5.6 10 20.3 3.3 12 17.8 0.7 2 17.8 trg L066-086 11 34 59.7 −74 36 09 11.3 4.6 11 16.9 2.8 12 ... ... ... 16.9 ccd GJ0433 11 35 27.0 −32 32 24 8.7 2.4 10 8.1 1.3 12 8.9 0.1 2 8.9 trg LP851-027 11 36 57.1 −23 29 48 [23.0] 6.5 11 [23.1] 6.7 12 ... ... ... [23.1] ccd SCR1138-7721 11 38 16.8 −77 21 49 8.8 2.7 11 9.5 1.7 12 8.2 0.2 1 8.2 trg GJ1147 11 38 25.0 −41 22 33 18.1 5.0 11 17.4 2.7 12 15.1 0.3 1 15.1 trg LP673-025 11 40 18.0 −08 11 27 23.5 6.6 11 ... ... ... ... ... ... 23.5 plt SIP1141-3624 11 41 21.5 −36 24 35 9.8 3.1 11 9.9 1.6 12 ... ... ... 9.9 ccd UPM1142-6440 11 42 29.9 −64 40 34 23.8 8.3 11 19.3 3.1 12 ... ... ... 19.3 ccd GJ0438 11 43 19.8 −51 50 26 12.4 4.2 2 12.6 2.0 12 10.9 0.2 2 10.9 trg SCR1144-4302 11 44 24.9 −43 02 54 24.7 7.4 11 21.2 3.6 12 ... ... ... 21.2 ccd LP793-033 11 45 34.5 −20 21 12 15.9 4.9 11 17.7 2.8 12 19.3 1.3 1 19.3 trg SIP1145-4055 11 45 35.4 −40 55 59 17.7 5.6 11 ... ... ... ... ... ... 17.7 plt GJ0443 11 46 42.9 −14 00 52 15.0 4.0 11 12.2 2.1 12 19.5 1.2 2 19.5 trg SCR1147-5504 11 47 52.5 −55 04 12 24.2 8.1 11 23.1 3.6 12 ... ... ... 23.1 ccd LHS2460 11 48 19.4 −11 17 14 18.4 5.3 11 17.8 3.0 12 ... ... ... 17.8 ccd LP613-062 11 51 55.3 −01 31 32 24.2 9.0 11 17.5 2.7 12 ... ... ... 17.5 ccd LTT04404 11 51 55.4 −27 29 10 21.0 5.8 11 ... ... ... ... ... ... 21.0 plt LP961-051 11 52 35.6 −35 09 43 24.6 6.5 11 ... ... ... ... ... ... 24.6 plt LHS0317 11 53 12.4 −31 23 56 18.5 5.7 11 17.7 3.0 12 ... ... ... 17.7 ccd GJ0452 11 53 16.1 −07 22 28 16.3 5.2 11 16.8 2.6 12 19.0 1.3 2 19.0 trg LP961-053 11 54 18.4 −37 33 10 19.8 5.6 11 ... ... ... ... ... ... 19.8 plt LP851-346 11 55 42.9 −22 24 59 10.3 2.8 11 9.9 1.6 11 11.2 0.2 1 11.2 trg LHS2476 11 55 44.3 −18 54 32 24.0 6.9 11 22.3 3.4 12 ... ... ... 22.3 ccd GJ2086 11 55 49.2 −38 16 49 21.9 6.2 11 26.5 4.1 12 24.3 1.7 1 24.3 trg SCR1157-0149 11 57 45.6 −01 49 03 22.2 6.5 11 21.4 3.4 12 ... ... ... 21.4 ccd LP851-399 11 57 53.5 −23 49 01 24.2 7.0 11 21.0 3.3 12 ... ... ... 21.0 ccd RXJ1159-5247 11 59 27.4 −52 47 19 10.7 3.7 8 10.8 1.8 11 ... ... ... 10.8 ccd L325-274 12 00 22.9 −49 31 14 20.4 6.1 11 ... ... ... ... ... ... 20.4 plt LHS5205 12 00 36.9 −13 49 36 [19.8] 5.7 11 [17.0] 3.1 12 ... ... ... [17.0] ccd L829-010 12 01 40.8 −12 13 54 [18.6] 5.1 11 [19.5] 3.0 12 ... ... ... [19.5] ccd GJ2088 12 02 13.2 −38 00 29 [14.4] 4.0 11 [18.1] 2.9 10 22.9 1.0 1 22.9 trg

– 85 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP794-013 12 02 16.9 −16 22 04 20.7 5.5 11 ... ... ... ... ... ... 20.7 plt LP908-010 12 03 28.1 −29 23 00 30.5 10.9 11 24.7 3.8 12 ... ... ... 24.7 ccd SIP1203-4023 12 03 51.3 −40 23 42 20.4 5.9 11 ... ... ... ... ... ... 20.4 plt LHS2506 12 03 58.3 −33 01 27 20.1 5.6 11 ... ... ... ... ... ... 20.1 plt LP852-005 12 05 12.9 −25 33 54 22.8 6.0 11 21.5 3.5 12 ... ... ... 21.5 ccd L397-071 12 06 39.1 −44 27 54 16.2 4.3 11 ... ... ... ... ... ... 16.2 plt SCR1206-3500 12 06 58.5 −35 00 52 21.0 5.9 11 17.7 2.7 12 ... ... ... 17.7 ccd GJ0456 12 08 22.2 −00 28 58 19.9 6.5 10 26.6 4.6 10 24.9 1.6 2 24.9 trg LP734-030 12 08 47.1 −10 16 00 19.9 5.4 11 19.5 3.3 12 ... ... ... 19.5 ccd SCR1209-3815 12 09 23.6 −38 15 43 20.0 5.7 11 20.3 3.3 12 ... ... ... 20.3 ccd LP908-025 12 09 54.1 −29 20 16 19.3 5.6 11 21.4 3.4 12 ... ... ... 21.4 ccd LHS2520 12 10 05.6 −15 04 17 8.8 2.4 11 7.6 1.2 12 12.8 0.4 1 12.8 trg LHS2521 12 10 11.6 −31 58 24 20.8 6.2 11 ... ... ... ... ... ... 20.8 plt LP734-034 12 10 28.4 −13 10 24 16.3 4.4 11 13.9 2.2 12 ... ... ... 13.9 ccd SCR1210-2213 12 10 42.2 −22 13 09 [24.5] 6.6 11 [21.5] 4.6 12 ... ... ... [21.5] ccd L758-108 12 11 11.8 −19 57 38 12.4 3.3 11 12.3 1.9 12 12.6 0.4 1 12.6 trg LP852-057 12 13 32.9 −25 55 25 20.0 5.6 11 23.1 3.7 12 23.4 1.1 1 23.4 trg SCR1214-4603 12 14 40.0 −46 03 14 18.0 6.9 11 14.2 2.2 12 ... ... ... 14.2 ccd SCR1217-7810 12 17 26.9 −78 10 46 24.5 8.6 11 23.3 3.8 12 ... ... ... 23.3 ccd LP674-104 12 18 34.9 −06 25 23 19.2 5.2 11 ... ... ... ... ... ... 19.2 plt LP052-034 12 19 48.8 −23 32 05 21.6 7.4 11 ... ... ... ... ... ... 21.6 plt LP794-053 12 20 05.1 −18 13 00 21.1 6.4 11 ... ... ... ... ... ... 21.1 plt L018-022 12 20 33.8 −82 25 58 8.5 2.6 11 8.1 1.2 12 ... ... ... 8.1 ccd L038-047 12 22 06.8 −78 38 27 14.0 3.8 11 14.7 2.3 12 ... ... ... 14.7 ccd GJ1157 12 23 01.4 −46 37 09 18.2 5.8 11 15.0 2.4 12 16.0 0.2 1 16.0 trg 2MA1223-4606 12 23 38.6 −46 06 20 [19.7] 6.0 11 ... ... ... ... ... ... [19.7] plt LHS0325a 12 23 56.2 −27 57 46 24.5 7.2 11 20.7 3.4 12 ... ... ... 20.7 ccd SCR1224-5339 12 24 24.4 −53 39 09 25.0 9.5 11 20.9 3.3 12 ... ... ... 20.9 ccd GJ0465 12 24 52.2 −12 38 36 13.2 3.6 11 14.3 2.4 12 9.0 0.1 3 9.0 trg BRI1222-1222 12 24 52.5 −18 14 32 15.9 5.5 11 16.8 2.8 12 17.1 1.1 1 17.1 trg LHS2557 12 25 32.0 −15 59 42 17.6 5.2 11 11.8 1.9 12 ... ... ... 11.8 ccd LP735-048 12 26 44.1 −12 29 18 22.1 6.5 10 17.5 3.3 12 ... ... ... 17.5 ccd LP852-050 12 27 02.2 −25 45 01 24.5 7.2 11 ... ... ... ... ... ... 24.5 plt LP735-011 12 28 53.0 −10 39 51 [14.1] 4.4 4 [15.0] 3.1 11 ... ... ... [15.0] ccd GJ1158 12 29 34.5 −55 59 37 12.4 3.5 11 13.5 2.1 12 13.1 0.2 1 13.1 trg LHS2567 12 29 54.2 −05 27 24 [22.5] 7.5 8 13.6 2.1 12 21.0 0.6 2 21.0 trg SCR1230-3411 12 30 01.8 −34 11 24 [12.6] 3.7 11 [11.7] 1.8 12 ... ... ... [11.7] ccd L194-073 12 30 16.6 −57 37 20 19.8 5.7 11 ... ... ... ... ... ... 19.8 plt L327-030 12 30 44.9 −46 22 43 20.4 5.6 11 ... ... ... ... ... ... 20.4 plt LP735-016 12 32 44.5 −15 30 55 23.5 8.5 11 ... ... ... ... ... ... 23.5 plt L327-121 12 33 33.1 −48 26 11 10.4 2.8 11 10.5 1.7 12 ... ... ... 10.5 ccd LP735-019 12 34 44.5 −10 47 41 23.8 6.5 11 ... ... ... ... ... ... 23.8 plt GJ0477 12 35 58.4 −45 56 21 [13.8] 3.9 11 [13.4] 2.3 12 18.3 1.0 2 18.3 trg LP795-038 12 37 21.6 −20 52 36 16.5 4.5 11 13.3 2.3 12 ... ... ... 13.3 ccd LHS5221 12 37 21.7 −32 00 37 21.0 8.7 11 ... ... ... ... ... ... 21.0 plt GJ0479 12 37 52.2 −52 00 06 7.6 2.0 11 7.5 1.2 12 9.6 0.2 2 9.6 trg 2MA1238-2703 12 38 37.1 −27 03 35 16.3 4.6 11 ... ... ... ... ... ... 16.3 plt

– 86 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

GJ1162 12 38 47.3 −04 19 17 20.0 6.1 11 17.2 2.6 12 19.7 1.2 1 19.7 trg LHS0337 12 38 49.1 −38 22 54 10.7 3.6 11 9.2 1.8 12 6.4 0.1 1 6.4 trg LP735-024 12 38 52.2 −10 02 40 24.2 6.5 11 ... ... ... ... ... ... 24.2 plt CE258 12 39 17.5 −34 27 25 24.7 8.0 11 ... ... ... ... ... ... 24.7 plt LHS2597 12 39 36.4 −26 58 11 16.0 6.0 11 ... ... ... ... ... ... 16.0 plt GJ0480.1 12 40 46.3 −43 33 59 14.5 4.2 11 12.9 2.3 12 8.0 0.2 2 8.0 trg SCR1240-8116 12 40 56.0 −81 16 31 19.2 6.1 11 19.2 3.0 12 ... ... ... 19.2 ccd SCR1241-4655 12 41 03.3 −46 55 23 21.5 5.8 11 21.1 3.3 12 ... ... ... 21.1 ccd LHS5224 12 41 26.6 −56 42 00 20.1 6.0 11 ... ... ... ... ... ... 20.1 plt LHS2608 12 42 19.7 −71 38 20 16.2 5.6 11 ... ... ... ... ... ... 16.2 plt LP796-001 12 43 58.9 −16 14 35 15.3 4.4 11 ... ... ... ... ... ... 15.3 plt LHS5226 12 44 00.7 −11 10 30 15.0 4.2 11 14.7 2.4 12 ... ... ... 14.7 ccd LP736-031 12 44 31.0 −11 42 15 21.5 6.0 11 ... ... ... ... ... ... 21.5 plt LTT04866 12 44 37.6 −41 55 38 22.4 6.2 11 ... ... ... ... ... ... 22.4 plt SCR1245-5506 12 45 52.5 −55 06 50 11.5 3.4 11 11.4 1.8 12 ... ... ... 11.4 ccd LP796-006 12 46 59.8 −19 02 30 18.8 5.2 11 ... ... ... ... ... ... 18.8 plt LHS2634 12 47 09.8 −03 34 18 18.7 4.9 11 17.0 2.7 12 ... ... ... 17.0 ccd LP853-034 12 47 10.0 −22 22 37 18.2 4.8 11 19.4 3.1 12 ... ... ... 19.4 ccd SCR1247-0525 12 47 14.7 −05 25 13 24.2 9.6 11 20.1 3.4 12 ... ... ... 20.1 ccd LHS5228 12 47 46.9 −08 36 17 22.6 6.7 11 ... ... ... ... ... ... 22.6 plt GJ0488 12 50 43.6 −00 46 05 5.9 1.6 8 8.3 1.4 9 10.6 0.1 2 10.6 trg DEN1250-2121 12 50 52.7 −21 21 14 12.3 3.5 11 11.2 1.7 12 17.3 0.5 1 17.3 trg LP909-045 12 52 16.8 −32 27 08 22.7 6.8 11 ... ... ... ... ... ... 22.7 plt LTT04925 12 53 19.4 −05 19 53 18.8 5.0 11 ... ... ... ... ... ... 18.8 plt L256-005 12 53 47.8 −50 49 35 22.2 6.8 11 ... ... ... ... ... ... 22.2 plt LP736-015 12 56 02.1 −12 57 22 16.2 8.1 11 ... ... ... ... ... ... 16.2 plt LP854-003 12 56 13.3 −22 04 59 23.7 6.4 11 21.2 3.3 12 ... ... ... 21.2 ccd SIP1259-4336 12 59 04.8 −43 36 25 8.3 2.6 11 8.1 1.3 11 ... ... ... 8.1 ccd LHS5231 12 59 18.2 −00 10 33 14.8 4.0 11 14.3 2.2 12 ... ... ... 14.3 ccd LP854-057 12 59 41.7 −26 50 16 21.0 5.6 11 ... ... ... ... ... ... 21.0 plt LTT04969 13 00 04.0 −05 37 48 16.5 4.4 11 15.4 2.4 12 ... ... ... 15.4 ccd L256-025 13 00 43.3 −52 09 41 20.4 5.8 11 ... ... ... ... ... ... 20.4 plt LHS2668 13 01 19.7 −63 11 42 13.4 4.0 11 16.7 2.6 12 17.2 0.7 2 17.2 trg LP910-013 13 06 12.2 −29 56 35 22.3 6.8 11 ... ... ... ... ... ... 22.3 plt LTT05031 13 08 51.2 −01 31 08 19.1 5.2 11 18.7 2.9 12 ... ... ... 18.7 ccd LHS0346 13 09 20.4 −40 09 27 20.3 5.8 11 15.7 2.4 12 16.2 0.3 1 16.2 trg CE303 13 09 21.9 −23 30 36 12.8 4.2 11 13.2 2.1 12 14.4 0.3 1 14.4 trg SCR1311-4619 13 11 49.3 −46 19 17 26.9 8.3 11 22.0 3.5 12 ... ... ... 22.0 ccd LTT05056 13 12 31.7 −27 02 23 23.8 6.4 11 ... ... ... ... ... ... 23.8 plt WT0392 13 13 09.3 −41 30 40 11.5 3.4 11 8.3 1.3 12 12.0 0.2 1 12.0 trg LP617-021 13 15 18.5 −02 49 52 18.7 5.5 11 ... ... ... ... ... ... 18.7 plt LHS2707 13 16 04.2 −55 16 42 24.9 6.9 11 ... ... ... ... ... ... 24.9 plt LHS2704 13 16 16.5 −73 08 35 21.8 6.0 11 21.6 3.3 12 ... ... ... 21.6 ccd LP737-014 13 16 45.4 −12 20 20 22.2 6.0 11 ... ... ... ... ... ... 22.2 plt LTT05105 13 18 19.0 −46 47 30 23.3 6.2 11 ... ... ... ... ... ... 23.3 plt LP617-030 13 19 29.1 −03 21 40 23.6 7.4 11 ... ... ... ... ... ... 23.6 plt L401-070 13 19 32.6 −42 45 30 18.1 4.8 11 ... ... ... ... ... ... 18.1 plt

– 87 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LHS2718 13 20 03.9 −35 24 44 14.6 4.0 11 16.0 2.5 12 13.7 0.2 1 13.7 trg L977-016 13 20 24.9 −01 39 27 18.7 5.3 11 21.9 3.4 12 21.5 1.5 1 21.5 trg LP737-051 13 21 54.1 −14 24 10 24.7 8.0 11 ... ... ... ... ... ... 24.7 plt L257-129 13 22 04.7 −55 00 59 16.2 4.4 11 ... ... ... ... ... ... 16.2 plt LHS2729 13 23 38.0 −25 54 45 14.0 4.2 11 12.6 1.9 12 14.0 0.3 1 14.0 trg G014-052 13 24 46.5 −05 04 20 14.7 4.7 11 16.0 2.5 12 ... ... ... 16.0 ccd GJ0510 13 25 48.9 −28 22 26 13.0 3.6 11 15.5 2.4 12 16.7 0.7 2 16.7 trg LHS2739 13 27 19.6 −31 10 40 [18.3] 5.0 11 [17.7] 2.7 7 20.0 1.0 1 20.0 trg LP855-014 13 27 54.0 −26 57 01 14.3 4.0 11 16.5 6.7 9 21.1 1.3 1 21.1 trg GJ0512 13 28 21.1 −02 21 37 11.7 3.2 11 9.4 1.6 12 13.7 0.5 2 13.7 trg LP677-097 13 28 24.2 −03 59 13 20.8 7.0 11 ... ... ... ... ... ... 20.8 plt 2MA1328-3654 13 28 32.9 −36 54 23 21.1 5.8 11 ... ... ... ... ... ... 21.1 plt LHS2743 13 30 25.8 −52 02 40 20.5 5.6 11 ... ... ... ... ... ... 20.5 plt LEP1330-2039 13 30 40.9 −20 39 03 16.1 4.5 11 10.7 1.7 12 ... ... ... 10.7 ccd LP855-025 13 31 27.4 −23 04 57 22.2 6.1 11 ... ... ... ... ... ... 22.2 plt LP911-026 13 32 55.8 −29 16 20 17.7 5.5 11 ... ... ... ... ... ... 17.7 plt LHS2758 13 34 23.6 −26 22 12 17.7 4.9 11 ... ... ... ... ... ... 17.7 plt L330-100 13 35 11.5 −48 21 26 18.4 5.5 10 ... ... ... ... ... ... 18.4 plt LP330-008 13 36 23.1 −45 56 16 14.9 6.4 10 ... ... ... ... ... ... 14.9 plt 2MA1338-2516 13 38 25.6 −25 16 47 [17.9] 5.2 11 ... ... ... ... ... ... [17.9] plt LTT05282 13 38 53.4 −02 15 47 18.4 6.4 10 19.9 3.1 12 ... ... ... 19.9 ccd L906-011 13 38 58.7 −06 14 13 16.4 4.8 11 21.5 3.5 10 23.6 1.2 1 23.6 trg LP678-016 13 38 59.7 −06 44 36 23.7 6.4 11 ... ... ... ... ... ... 23.7 plt GJ0521.1 13 40 07.1 −04 11 10 10.3 3.1 8 13.8 2.4 10 14.8 0.3 2 14.8 trg LTT05298 13 40 45.5 −31 10 15 19.6 6.0 11 ... ... ... ... ... ... 19.6 plt LHS2783 13 42 09.9 −16 00 23 19.6 5.5 11 12.7 2.0 12 ... ... ... 12.7 ccd SCR1343-4002 13 43 41.5 −40 02 29 18.0 6.5 11 16.2 2.5 12 ... ... ... 16.2 ccd LP855-060 13 44 20.9 −26 18 35 15.2 4.2 11 ... ... ... ... ... ... 15.2 plt LP798-029 13 44 37.1 −19 54 44 20.1 5.5 11 ... ... ... ... ... ... 20.1 plt GJ0524 13 44 48.8 −54 07 18 19.8 6.6 11 22.4 3.5 12 ... ... ... 22.4 ccd LHS2794 13 45 50.7 −17 58 06 9.4 2.7 11 9.2 1.4 12 10.2 0.5 1 10.2 trg LP911-056 13 46 46.0 −31 49 26 13.4 3.7 11 ... ... ... ... ... ... 13.4 plt LHS2804 13 48 40.8 −05 17 08 23.9 6.6 11 ... ... ... ... ... ... 23.9 plt UPM1349-4228 13 49 01.0 −42 31 10 11.4 7.2 8 24.7 3.8 12 ... ... ... 24.7 ccd L039-039 13 49 02.5 −79 25 54 17.2 4.6 11 17.9 3.1 12 ... ... ... 17.9 ccd L691-021 13 50 23.8 −21 37 20 17.7 4.9 11 19.8 3.1 12 ... ... ... 19.8 ccd LHS2813 13 51 21.8 −53 32 46 15.4 4.4 11 18.6 2.9 12 ... ... ... 18.6 ccd LP798-049 13 51 57.1 −17 58 49 20.6 7.9 11 ... ... ... ... ... ... 20.6 plt LP798-051 13 52 53.5 −18 20 17 17.6 4.9 11 20.7 3.3 12 23.3 1.8 1 23.3 trg LHS2822 13 53 55.6 −20 14 43 21.2 5.6 11 ... ... ... ... ... ... 21.2 plt 2MA1354-7121 13 54 53.9 −71 21 48 19.3 5.7 11 16.4 2.6 12 ... ... ... 16.4 ccd GJ1181 13 55 02.6 −29 05 26 [7.2] 2.2 11 [9.8] 1.8 12 17.3 0.4 1 17.3 trg L070-053 13 55 28.0 −73 29 41 17.1 5.7 11 20.4 3.1 12 ... ... ... 20.4 ccd LTT05425 13 55 35.1 −07 23 17 19.1 5.1 11 ... ... ... ... ... ... 19.1 plt LHS2826 13 56 20.6 −28 03 50 22.1 6.7 11 20.3 3.2 12 ... ... ... 20.3 ccd LP475-052 13 57 14.0 −38 32 28 24.8 6.6 11 ... ... ... ... ... ... 24.8 plt SSS1358-3938 13 58 05.4 −39 37 55 24.2 9.3 11 21.7 3.8 12 ... ... ... 21.7 ccd

– 88 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP739-002 13 58 16.2 −12 02 59 23.0 7.4 11 15.6 2.5 12 ... ... ... 15.6 ccd LP739-003 13 58 19.6 −13 16 25 21.5 6.6 11 16.3 2.5 12 ... ... ... 16.3 ccd LHS2836 13 59 10.4 −19 50 04 9.7 2.7 11 8.9 1.4 12 10.8 0.1 1 10.8 trg SIP1400-4109 14 00 49.7 −41 09 54 22.0 7.3 11 ... ... ... ... ... ... 22.0 plt GJ0536 14 01 03.2 −02 39 18 8.6 2.8 6 9.5 1.5 12 10.0 0.2 2 10.0 trg LHS2848 14 02 28.9 −21 00 37 16.5 4.5 11 17.9 2.8 12 ... ... ... 17.9 ccd LHS2852 14 02 46.7 −24 31 50 19.6 6.0 11 21.8 3.5 12 ... ... ... 21.8 ccd LP912-046 14 04 03.2 −30 00 47 19.3 5.9 11 ... ... ... ... ... ... 19.3 plt L106-015 14 04 08.2 −66 14 38 5.7 4.5 11 11.0 1.8 12 ... ... ... 11.0 ccd LP912-048 14 05 36.9 −32 08 39 21.2 6.9 11 ... ... ... ... ... ... 21.2 plt LP679-084 14 06 39.3 −05 43 29 19.8 5.8 11 ... ... ... ... ... ... 19.8 plt LP912-052 14 08 41.0 −28 01 04 23.6 7.8 11 ... ... ... ... ... ... 23.6 plt LTT05526 14 09 36.5 −41 22 28 21.7 6.0 11 ... ... ... ... ... ... 21.7 plt L548-010 14 10 57.5 −31 17 25 10.7 2.9 11 14.0 2.2 12 16.8 0.6 1 16.8 trg WT0460 14 11 59.9 −41 32 21 [9.6] 3.2 11 [7.3] 1.1 12 9.3 0.1 1 9.3 trg LHS2875 14 12 11.0 −00 35 04 30.3 8.6 11 26.4 4.2 12 24.9 2.1 1 24.9 trg GJ0540.2 14 13 04.9 −12 01 27 12.1 3.4 11 10.2 1.6 12 ... ... ... 10.2 ccd GJ2106 14 13 12.9 −56 44 32 7.3 3.7 10 11.4 1.8 12 11.7 0.3 1 11.7 trg LP739-036 14 15 46.4 −13 29 34 23.6 6.3 11 ... ... ... ... ... ... 23.6 plt L404-216 14 16 47.5 −44 53 21 16.8 5.1 11 ... ... ... ... ... ... 16.8 plt L404-010 14 17 25.9 −40 18 15 15.9 4.3 11 ... ... ... ... ... ... 15.9 plt LP619-064 14 17 59.1 −00 31 29 18.8 5.5 11 ... ... ... ... ... ... 18.8 plt GJ0543 14 19 11.0 −07 18 12 34.4 10.5 9 30.4 5.6 12 19.3 1.7 1 19.3 trg GJ0545 14 20 07.4 −09 37 13 15.7 4.4 11 15.7 2.6 12 14.0 0.3 3 14.0 trg SCR1420-7516 14 20 36.8 −75 16 06 21.4 6.7 11 18.0 2.9 12 ... ... ... 18.0 ccd LHS2899 14 21 15.1 −01 07 20 14.1 3.9 11 15.4 2.4 12 13.4 0.4 1 13.4 trg LP913-013 14 21 49.0 −31 54 35 17.4 4.6 11 22.9 3.6 12 ... ... ... 22.9 ccd GJ2107 14 23 06.4 −68 22 58 11.4 4.9 9 17.3 2.9 9 23.5 0.8 1 23.5 trg LHS2906 14 23 07.8 −22 17 09 21.9 6.5 11 21.9 3.4 12 ... ... ... 21.9 ccd LP800-058 14 25 13.3 −16 24 56 23.3 7.3 11 ... ... ... ... ... ... 23.3 plt LP740-010 14 25 34.1 −11 48 52 18.3 5.0 11 ... ... ... ... ... ... 18.3 plt LP620-012 14 26 36.8 −01 15 23 23.3 6.9 11 ... ... ... ... ... ... 23.3 plt GJ1183 14 27 56.1 −00 22 31 12.4 5.2 11 12.7 2.0 12 16.2 0.8 1 16.2 trg GJ0550.3 14 29 18.6 −46 27 50 15.4 4.4 11 20.2 3.2 9 23.5 1.2 2 23.5 trg LP913-027 14 29 49.2 −29 32 14 22.2 5.9 11 ... ... ... ... ... ... 22.2 plt GJ0553 14 30 47.7 −08 38 47 8.6 2.3 4 12.1 2.1 10 16.8 0.4 2 16.8 trg GJ0552.1 14 30 58.9 −54 06 05 13.2 5.3 11 16.3 3.9 11 ... ... ... 16.3 ccd GJ0553.1 14 31 01.2 −12 17 46 12.3 3.5 11 9.2 1.5 12 10.9 0.4 2 10.9 trg LP740-020 14 31 15.6 −13 18 25 23.8 7.4 11 ... ... ... ... ... ... 23.8 plt LHS0375 14 31 38.3 −25 25 33 94.9 26.1 11 126.3 24.8 12 24.0 0.6 1 24.0 trg SIP1432-3326 14 32 04.8 −33 26 26 [19.8] 6.3 11 ... ... ... ... ... ... [19.8] plt LP913-077 14 32 18.0 −33 20 59 17.7 5.0 11 ... ... ... ... ... ... 17.7 plt LP857-051 14 33 12.2 −22 12 31 24.5 6.6 11 ... ... ... ... ... ... 24.5 plt LHS5273 14 34 04.9 −18 24 11 16.8 5.4 11 ... ... ... ... ... ... 16.8 plt GJ0555 14 34 16.8 −12 31 10 4.8 1.4 11 4.5 0.7 12 6.2 0.1 3 6.2 trg LP913-046 14 36 18.1 −30 57 33 25.0 6.7 11 ... ... ... ... ... ... 25.0 plt LP620-047 14 38 39.4 −02 57 24 24.0 6.5 11 ... ... ... ... ... ... 24.0 plt

– 89 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L333-199 14 40 20.8 −48 36 59 15.5 4.6 11 ... ... ... ... ... ... 15.5 plt LP914-006 14 40 22.1 −27 52 42 21.6 5.7 11 23.4 3.6 12 ... ... ... 23.4 ccd LTT05828 14 41 09.9 −08 59 20 16.8 4.9 11 ... ... ... ... ... ... 16.8 plt SCR1441-7338 14 41 14.4 −73 38 41 19.0 5.5 11 16.8 2.7 12 ... ... ... 16.8 ccd LP680-049 14 41 15.3 −06 59 09 21.3 6.6 11 ... ... ... ... ... ... 21.3 plt LTT05831 14 41 35.8 −09 46 39 [15.1] 4.9 11 ... ... ... ... ... ... [15.1] plt SCR1444-3426 14 44 06.6 −34 26 47 24.0 7.5 11 18.8 3.0 12 ... ... ... 18.8 ccd LP858-020 14 44 15.0 −27 17 26 23.8 7.4 11 ... ... ... ... ... ... 23.8 plt SSS1444-2019 14 44 20.3 −20 19 26 28.0 8.5 11 27.8 6.3 9 16.2 0.5 2 16.2 trg GJ1185 14 47 55.2 −03 09 36 31.6 8.4 11 38.3 6.8 12 19.7 1.4 1 19.7 trg GJ0563.2 14 49 33.2 −26 06 20 15.0 6.8 11 22.5 3.5 12 19.6 3.1 3 19.6 trg SIP1452-3458 14 52 52.9 −34 58 47 25.0 10.7 11 ... ... ... ... ... ... 25.0 plt LP801-025 14 54 10.4 −20 41 29 19.8 6.8 11 ... ... ... ... ... ... 19.8 plt LTT05930 14 54 58.3 −11 23 21 18.1 4.9 11 ... ... ... ... ... ... 18.1 plt SCR1456-7239 14 56 02.3 −72 39 41 24.9 7.0 11 22.9 3.6 12 ... ... ... 22.9 ccd LP406-203 14 56 37.7 −44 56 28 23.5 7.4 11 ... ... ... ... ... ... 23.5 plt LHS3003 14 56 38.3 −28 09 49 6.7 2.6 11 6.6 1.0 12 6.6 0.1 3 6.6 trg LP681-091 14 57 33.3 −06 19 49 23.5 6.5 7 30.4 5.5 10 24.5 2.8 1 24.5 trg SCR1459-4210 14 59 57.4 −42 10 09 26.1 8.6 11 24.8 3.9 12 ... ... ... 24.8 ccd L072-010 15 02 07.7 −71 18 01 14.8 4.5 11 13.1 2.1 12 ... ... ... 13.1 ccd LP914-041 15 03 13.2 −28 40 14 24.0 6.9 11 ... ... ... ... ... ... 24.0 plt L406-116 15 03 42.2 −42 38 51 22.7 6.1 11 ... ... ... ... ... ... 22.7 plt LP859-001 15 04 16.2 −23 55 57 17.4 5.7 11 ... ... ... ... ... ... 17.4 plt LP859-011 15 08 23.4 −23 51 38 18.6 4.9 11 20.0 3.1 12 ... ... ... 20.0 ccd TVLM868-110639 15 10 16.8 −02 41 08 15.3 6.2 11 16.4 2.8 10 16.3 1.3 1 16.3 trg LTT06043 15 10 35.7 −42 58 37 16.9 5.0 5 ... ... ... 24.4 1.4 2 24.4 trg SCR1511-3403 15 11 38.6 −34 03 17 16.1 7.4 11 20.5 3.2 12 ... ... ... 20.5 ccd LHS0392 15 11 50.6 −10 14 18 21.6 6.3 11 17.0 2.7 12 14.8 0.7 1 14.8 trg LP682-018 15 15 43.7 −07 25 21 13.6 3.9 11 11.6 1.8 12 ... ... ... 11.6 ccd LEHPM2-0027 15 16 53.1 −28 32 16 22.0 6.4 11 ... ... ... ... ... ... 22.0 plt LTT06063 15 17 21.7 −80 28 23 17.8 6.0 11 ... ... ... ... ... ... 17.8 plt LHS3056 15 19 11.7 −12 45 07 11.6 3.2 11 10.3 1.6 12 ... ... ... 10.3 ccd GJ0581 15 19 26.8 −07 43 20 5.8 1.5 11 6.6 1.0 12 6.3 0.1 3 6.3 trg LTT06128 15 21 34.3 −02 16 58 17.6 5.0 11 ... ... ... ... ... ... 17.6 plt GJ2112 15 22 13.0 −27 49 43 [17.2] 4.9 11 ... ... ... ... ... ... [17.2] plt G151-064 15 29 01.4 −06 12 46 24.4 7.0 11 ... ... ... ... ... ... 24.4 plt LP802-069 15 29 07.2 −17 22 55 14.7 4.0 8 ... ... ... 24.9 1.6 1 24.9 trg L480-094 15 29 40.7 −38 32 28 21.2 7.7 11 ... ... ... ... ... ... 21.2 plt L108-087 15 30 52.0 −68 01 18 14.5 4.9 11 13.5 2.1 12 ... ... ... 13.5 ccd LHS3079 15 31 38.3 −26 54 07 19.3 8.8 11 22.2 3.5 12 ... ... ... 22.2 ccd LP915-041 15 31 39.9 −29 16 29 18.1 6.6 11 24.4 4.0 12 ... ... ... 24.4 ccd GJ0588 15 32 13.0 −41 16 32 2.8 0.8 11 4.5 0.7 12 5.9 0.0 2 5.9 trg LEHPM2-0455 15 32 18.9 −25 51 03 23.9 9.8 11 ... ... ... ... ... ... 23.9 plt 2MA1534-1418 15 34 56.9 −14 18 49 9.6 3.2 11 10.9 1.8 9 ... ... ... 10.9 ccd GJ0590 15 36 34.5 −37 54 23 9.0 3.9 11 11.6 2.0 12 ... ... ... 11.6 ccd GJ0592 15 36 58.6 −14 08 02 15.3 4.8 11 11.3 1.7 12 13.4 0.7 1 13.4 trg LP623-020 15 38 14.1 −01 54 55 19.3 5.7 11 ... ... ... ... ... ... 19.3 plt

– 90 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

SIP1540-2613 15 40 29.6 −26 13 43 13.7 5.5 11 15.2 2.6 9 ... ... ... 15.2 ccd GJ0595 15 42 06.5 −19 28 18 10.5 2.9 11 12.3 2.0 12 10.1 0.4 2 10.1 trg GJ2116 15 43 18.3 −20 15 33 30.7 8.6 11 42.7 6.7 12 21.4 0.5 1 21.4 trg LHS3109 15 43 19.6 −30 55 51 22.8 7.0 11 24.8 3.8 12 ... ... ... 24.8 ccd L408-123 15 45 41.6 −43 30 29 [15.8] 4.9 11 [15.4] 2.4 12 ... ... ... [15.4] ccd LHS3112 15 45 54.5 −04 48 23 22.6 9.3 11 ... ... ... ... ... ... 22.6 plt LHS3114 15 46 31.9 −47 14 01 19.4 5.1 2 ... ... ... 24.3 1.9 2 24.3 trg SCR1546-5534 15 46 41.8 −55 34 47 6.7 4.7 8 6.7 1.1 12 ... ... ... 6.7 ccd LHS3117 15 47 24.6 −10 53 47 [8.5] 3.3 11 [11.2] 1.8 12 15.1 0.7 1 15.1 trg LP803-037 15 50 09.8 −20 29 11 25.0 9.4 11 ... ... ... ... ... ... 25.0 plt SCR1551-3554 15 51 12.2 −35 54 48 16.9 9.8 11 21.6 3.4 12 ... ... ... 21.6 ccd LHS5303 15 52 44.6 −26 23 14 11.0 3.1 11 9.4 1.5 12 10.6 0.1 1 10.6 trg LP860-046 15 53 57.1 −23 11 53 24.5 8.4 11 ... ... ... ... ... ... 24.5 plt LP409-071 15 54 00.8 −43 03 10 23.9 6.8 8 ... ... ... ... ... ... 23.9 plt LP683-049 15 54 50.4 −05 21 47 20.7 6.2 11 ... ... ... ... ... ... 20.7 plt LTT06368 15 58 27.8 −06 51 45 20.6 5.5 11 ... ... ... ... ... ... 20.6 plt GJ0606 15 59 53.4 −08 15 11 11.7 3.2 11 11.8 1.9 12 13.8 0.4 2 13.8 trg SCR1601-3421 16 01 55.7 −34 21 57 20.2 11.9 11 18.6 3.0 12 ... ... ... 18.6 ccd LHS3149 16 04 20.0 −06 16 46 21.1 7.1 11 ... ... ... ... ... ... 21.1 plt LP917-019 16 04 23.2 −33 03 40 10.9 4.9 9 18.0 3.1 10 22.9 1.1 1 22.9 trg 2MA1607-0442 16 07 31.2 −04 42 10 11.2 4.2 11 13.4 2.1 12 15.7 0.4 1 15.7 trg GJ1198 16 08 15.0 −10 26 14 27.8 8.3 11 26.5 4.8 12 21.2 1.2 1 21.2 trg SCR1608-2913 16 08 45.5 −29 13 06 [28.9] 8.4 11 [20.2] 4.6 12 ... ... ... [20.2] ccd LP481-066 16 09 13.0 −38 04 33 16.9 11.2 11 ... ... ... ... ... ... 16.9 plt SCR1609-3431 16 09 46.2 −34 31 07 22.5 10.3 11 21.9 3.5 12 ... ... ... 21.9 ccd LP684-033 16 10 58.4 −06 31 33 21.6 7.3 11 ... ... ... ... ... ... 21.6 plt LHS3165 16 12 07.1 −40 48 45 20.0 10.7 11 ... ... ... ... ... ... 20.0 plt LP804-027 16 12 41.8 −18 52 32 8.2 3.2 11 9.0 1.7 12 14.4 0.7 1 14.4 trg LHS3167 16 13 05.9 −70 09 08 17.3 5.5 11 14.7 2.3 12 16.6 0.3 1 16.6 trg LHS3169 16 14 21.9 −28 30 37 15.5 4.8 11 17.3 2.8 12 18.7 0.5 1 18.7 trg GJ0618 16 20 03.5 −37 31 45 [4.4] 2.9 9 7.3 1.2 12 8.3 0.2 2 8.3 trg LP917-025 16 20 37.6 −30 39 41 18.8 6.4 11 22.6 3.5 12 ... ... ... 22.6 ccd LP805-001 16 20 41.9 −20 05 14 12.6 9.5 11 15.7 2.5 12 ... ... ... 15.7 ccd LP625-004 16 21 26.3 −01 47 02 24.9 7.1 11 ... ... ... ... ... ... 24.9 plt GJ0618.4 16 22 41.0 −48 39 20 16.8 4.6 11 20.5 3.3 12 23.7 1.9 2 23.7 trg LEP1623-6905 16 23 02.8 −69 05 37 35.0 11.6 11 24.6 5.8 12 ... ... ... 24.6 ccd GJ0620 16 23 07.6 −24 42 35 7.1 5.2 10 14.3 2.4 12 16.5 0.6 2 16.5 trg LTT06556 16 25 01.5 −12 15 26 23.0 6.4 11 22.1 3.8 12 ... ... ... 22.1 ccd GJ0622 16 25 13.0 −21 56 14 10.8 4.8 10 17.9 3.1 10 18.1 0.7 2 18.1 trg LHS3197 16 26 48.1 −17 23 34 19.9 7.4 11 14.1 2.4 12 18.2 0.5 1 18.2 trg SCR1626-3812 16 26 51.7 −38 12 33 11.7 7.0 11 13.8 2.1 12 ... ... ... 13.8 ccd GJ2120 16 27 33.2 −10 00 29 15.2 4.7 11 15.8 2.7 12 22.9 1.7 1 22.9 trg GJ2121 16 30 13.1 −14 39 50 19.1 5.5 11 14.5 2.3 12 22.4 2.7 1 22.4 trg GJ0628 16 30 18.1 −12 39 45 5.7 1.8 10 3.9 0.6 12 4.3 0.0 2 4.3 trg SCR1630-3633 16 30 27.2 −36 33 56 [14.8] 5.9 11 [15.4] 3.8 12 ... ... ... [15.4] ccd 2MA1632-0631 16 32 58.8 −06 31 48 16.5 7.0 10 20.7 3.3 11 18.8 0.5 1 18.8 trg L339-020 16 34 43.8 −46 01 31 19.7 6.2 11 ... ... ... ... ... ... 19.7 plt

– 91 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L483-080 16 34 59.0 −38 34 34 18.1 10.4 11 ... ... ... ... ... ... 18.1 plt LHS3218 16 35 24.6 −27 18 55 16.2 7.1 11 20.9 3.7 12 18.6 0.3 1 18.6 trg UPM1635-5202 16 35 37.2 −52 02 01 17.6 5.5 11 16.5 2.9 12 ... ... ... 16.5 ccd LHS0423 16 35 40.4 −30 51 20 21.0 6.7 11 20.4 3.5 12 19.5 1.1 1 19.5 trg LP685-036 16 36 06.0 −04 40 13 24.4 8.6 11 ... ... ... ... ... ... 24.4 plt SCR1636-4041 16 36 57.6 −40 41 09 13.3 5.2 11 15.4 2.4 12 ... ... ... 15.4 ccd L555-115 16 36 58.4 −33 46 51 17.5 5.9 11 ... ... ... ... ... ... 17.5 plt SCR1639-4652 16 39 25.8 −46 53 00 17.6 4.8 11 20.1 3.1 12 ... ... ... 20.1 ccd GJ0633 16 40 45.3 −45 59 59 18.1 5.0 11 19.5 3.0 12 16.7 0.3 2 16.7 trg GJ0634 16 41 28.3 −43 59 11 15.6 4.4 11 17.6 2.8 12 17.4 2.0 1 17.4 trg LP686-002 16 43 55.9 −07 26 10 20.9 7.1 7 ... ... ... ... ... ... 20.9 plt 2MA1643-7530 16 43 57.7 −75 30 21 18.8 6.8 11 ... ... ... ... ... ... 18.8 plt 2MA1645-1319 16 45 22.1 −13 19 52 13.2 10.0 7 15.0 2.7 12 ... ... ... 15.0 ccd LP806-004 16 47 35.6 −19 44 27 18.6 5.6 11 21.6 3.5 12 ... ... ... 21.6 ccd LP154-205 16 47 55.2 −65 09 12 21.7 6.2 11 21.1 3.6 12 ... ... ... 21.1 ccd GJ0637 16 48 24.5 −72 58 34 14.6 6.0 11 17.8 2.9 12 15.9 0.5 2 15.9 trg LP806-008 16 48 46.0 −15 44 20 11.5 3.9 11 14.2 2.4 12 18.2 0.7 1 18.2 trg LHS3246 16 50 53.8 −04 50 35 24.1 6.5 11 23.5 4.0 12 ... ... ... 23.5 ccd GJ0644 16 55 28.8 −08 20 11 [3.5] 1.5 11 [3.8] 0.6 12 6.5 0.0 5 6.5 trg LTT06745 16 55 38.0 −32 04 04 7.6 3.5 9 14.6 2.5 9 18.3 0.4 1 18.3 trg SCR1656-2046 16 56 33.6 −20 46 37 17.8 6.4 11 16.3 2.7 12 ... ... ... 16.3 ccd GJ0645 16 56 45.1 −37 03 39 9.8 6.7 10 19.2 3.0 12 17.2 2.7 1 17.2 trg SCR1656-4238 16 56 49.8 −42 38 48 23.4 6.2 11 23.9 3.8 12 ... ... ... 23.9 ccd GJ1207 16 57 05.7 −04 20 56 9.7 4.7 10 9.3 1.6 12 8.7 0.1 2 8.7 trg SCR1659-6958 16 59 28.1 −69 58 18 27.6 9.2 11 22.1 4.2 12 ... ... ... 22.1 ccd LP746-041 17 00 42.2 −09 25 35 22.8 8.8 11 ... ... ... ... ... ... 22.8 plt LEHPM2-1755 17 06 50.0 −82 11 42 24.9 6.7 11 ... ... ... ... ... ... 24.9 plt BD-06-04552 17 07 34.8 −06 27 26 21.6 10.2 11 ... ... ... ... ... ... 21.6 plt NLTT44215 17 08 23.8 −18 27 58 22.0 13.9 10 ... ... ... ... ... ... 22.0 plt UPM1710-5300 17 10 44.3 −53 00 25 [13.5] 4.5 8 [13.4] 2.1 12 ... ... ... [13.4] ccd L268-067 17 10 59.2 −52 30 56 10.0 3.3 6 11.0 1.8 12 12.5 0.3 1 12.5 trg GJ0660 17 11 52.3 −01 51 06 [9.9] 3.2 11 [9.6] 1.5 12 11.7 0.3 2 11.7 trg LP919-015 17 12 01.2 −27 46 02 15.0 11.6 11 23.7 3.7 12 ... ... ... 23.7 ccd SIP1712-0323 17 12 04.3 −03 23 30 17.8 10.0 11 16.3 2.5 12 ... ... ... 16.3 ccd GJ0660.1 17 12 51.3 −05 07 32 {[22.3]} 8.2 10 {[31.1]} 5.0 10 20.0 1.4 2 20.0 trg LP413-057 17 13 09.6 −41 28 28 20.2 6.9 11 ... ... ... ... ... ... 20.2 plt GJ1212 17 13 40.5 −08 25 15 [11.8] 4.7 11 [12.0] 2.0 12 18.3 1.5 2 18.3 trg LTT06876 17 15 54.9 −02 50 10 21.1 9.4 9 ... ... ... ... ... ... 21.1 plt LP687-017 17 16 20.7 −05 23 51 12.2 6.9 11 17.1 2.7 12 ... ... ... 17.1 ccd L845-016 17 17 45.3 −11 48 54 11.0 3.7 11 13.0 3.1 12 ... ... ... 13.0 ccd LP687-045 17 18 29.1 −07 39 15 20.4 12.2 11 ... ... ... ... ... ... 20.4 plt OUT1720-1725 17 20 52.4 −17 25 40 21.0 10.5 11 18.8 3.0 12 ... ... ... 18.8 ccd GJ0672.1 17 23 49.2 −32 15 16 12.7 4.8 11 20.9 3.3 12 23.6 2.2 2 23.6 trg L989-038 17 24 16.9 −04 21 52 12.5 7.8 11 17.8 2.8 12 ... ... ... 17.8 ccd SCR1726-8433 17 26 22.9 −84 33 08 20.1 5.5 11 20.7 3.2 12 ... ... ... 20.7 ccd GJ1218 17 28 07.3 −62 27 14 10.0 2.9 11 10.8 1.7 12 16.3 0.3 2 16.3 trg SCR1728-0143 17 28 11.1 −01 43 57 16.4 8.3 11 18.3 2.8 12 ... ... ... 18.3 ccd

– 92 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

GJ0674 17 28 39.9 −46 53 43 5.7 2.2 8 4.9 0.8 12 4.5 0.0 2 4.5 trg LHS3295 17 29 27.3 −80 08 57 9.5 3.1 11 11.3 1.8 12 12.5 0.3 1 12.5 trg GJ0676 17 30 11.2 −51 38 13 5.9 3.0 9 11.7 1.9 10 16.3 0.4 2 16.3 trg SCR1731-2452 17 31 03.8 −24 52 44 9.6 5.5 8 19.4 3.1 12 ... ... ... 19.4 ccd LP920-019 17 31 20.9 −27 39 20 16.8 11.9 9 ... ... ... ... ... ... 16.8 plt SIP1731-7851 17 31 44.9 −78 51 26 20.7 9.7 11 ... ... ... ... ... ... 20.7 plt UPM1732-4736 17 32 21.9 −47 36 58 18.5 5.7 11 17.0 2.6 12 ... ... ... 17.0 ccd LP688-003 17 34 08.7 −08 49 52 21.9 11.7 11 ... ... ... ... ... ... 21.9 plt HD320012 17 34 15.4 −35 19 54 23.5 20.2 10 ... ... ... ... ... ... 23.5 plt GJ0680 17 35 13.6 −48 40 51 6.5 2.1 11 8.3 1.3 12 9.8 0.3 2 9.8 trg L112-088 17 36 14.6 −67 56 06 23.5 6.4 11 ... ... ... ... ... ... 23.5 plt GJ0682 17 37 03.7 −44 19 09 6.1 1.6 11 3.9 0.7 12 5.1 0.1 2 5.1 trg LP920-069 17 38 03.6 −30 00 57 15.1 5.4 11 ... ... ... ... ... ... 15.1 plt L204-148 17 38 32.5 −58 32 34 13.8 4.5 11 13.8 2.1 12 ... ... ... 13.8 ccd SCR1738-5942 17 38 41.0 −59 42 24 20.8 6.0 11 24.1 4.0 12 ... ... ... 24.1 ccd LHS3315 17 42 10.8 −08 49 00 22.8 13.4 11 ... ... ... 23.3 1.8 1 23.3 trg GJ0690.1 17 42 32.3 −16 38 25 18.8 10.9 11 31.2 5.0 12 19.4 2.0 1 19.4 trg LP921-012 17 44 17.4 −29 15 48 24.7 11.3 9 ... ... ... ... ... ... 24.7 plt LTT07069 17 45 07.4 −08 00 45 19.6 7.2 11 ... ... ... ... ... ... 19.6 plt L270-064 17 45 43.7 −52 47 38 25.0 6.6 11 ... ... ... ... ... ... 25.0 plt GJ2130 17 46 12.8 −32 06 09 ... ... 0 10.7 1.7 12 14.2 0.3 3 14.2 trg G154-016 17 46 23.3 −18 07 09 18.7 13.7 11 ... ... ... ... ... ... 18.7 plt LTT07077 17 46 29.4 −08 42 37 8.4 3.3 11 8.9 1.4 12 ... ... ... 8.9 ccd GJ0693 17 46 34.2 −57 19 09 6.9 2.7 11 7.1 1.1 12 5.8 0.1 2 5.8 trg SCR1746-3214 17 46 40.7 −32 14 04 9.9 3.2 11 11.2 1.8 12 ... ... ... 11.2 ccd NLTT45438 17 47 10.2 −01 29 55 19.0 6.8 11 ... ... ... ... ... ... 19.0 plt L415-082 17 57 14.2 −41 59 29 16.9 4.5 2 16.9 2.7 12 ... ... ... 16.9 ccd L271-081 17 57 22.6 −52 29 07 21.7 6.1 11 ... ... ... ... ... ... 21.7 plt LP749-016 17 59 58.7 −13 23 44 23.4 12.0 10 ... ... ... ... ... ... 23.4 plt G154-043 18 03 36.1 −18 58 51 8.5 5.8 11 9.9 1.5 12 ... ... ... 9.9 ccd GJ0701 18 05 07.6 −03 01 53 4.4 3.1 9 7.8 1.2 12 7.8 0.1 2 7.8 trg SCR1805-2042 18 05 15.1 −20 42 28 17.4 10.0 11 22.3 3.7 12 ... ... ... 22.3 ccd GJ1224 18 07 32.9 −15 57 47 7.1 3.3 11 9.1 1.6 12 7.9 0.1 2 7.9 trg LEP1809-0219 18 09 43.7 −02 19 35 11.9 9.4 11 16.0 2.5 12 ... ... ... 16.0 ccd NLTT46026 18 10 11.0 −15 25 48 23.0 15.2 11 ... ... ... ... ... ... 23.0 plt L043-072 18 11 15.3 −78 59 23 [7.0] 2.7 11 [6.4] 1.0 12 ... ... ... [ 6.4] ccd LP629-020 18 11 23.4 −02 17 50 22.9 14.6 8 ... ... ... ... ... ... 22.9 plt LHS3370 18 13 52.9 −77 08 21 40.6 11.1 11 43.9 8.6 12 23.3 2.3 1 23.3 trg LTT07246 18 15 12.4 −19 24 07 8.9 3.3 11 10.3 2.3 12 ... ... ... 10.3 ccd LHS3378 18 19 17.0 −77 02 50 22.0 7.7 11 ... ... ... ... ... ... 22.0 plt LP690-011 18 19 59.6 −06 17 32 20.6 13.6 10 ... ... ... ... ... ... 20.6 plt WT0562 18 26 19.8 −65 47 41 17.2 5.0 11 17.0 2.7 12 17.1 0.3 1 17.1 trg SCR1826-6542 18 26 46.8 −65 42 40 9.2 2.5 11 9.3 1.5 12 ... ... ... 9.3 ccd GJ0714 18 30 12.0 −58 16 28 9.7 2.8 11 12.0 2.0 10 ... ... ... 12.0 ccd L489-068 18 38 30.3 −39 04 31 23.3 6.3 11 ... ... ... ... ... ... 23.3 plt GJ2138 18 38 44.8 −14 29 26 [8.8] 2.6 11 [12.8] 2.0 12 12.9 0.5 1 12.9 trg GJ0723 18 40 17.8 −10 27 55 19.1 5.6 11 21.5 3.4 12 21.7 2.8 2 21.7 trg

– 93 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

Wolf1467 18 40 50.2 −08 04 59 19.2 9.4 11 ... ... ... ... ... ... 19.2 plt GJ0724 18 40 57.3 −13 22 47 8.4 4.1 11 13.3 2.3 12 16.5 0.5 2 16.5 trg SCR1841-4347 18 41 09.8 −43 47 33 14.6 4.3 11 11.9 2.0 12 ... ... ... 11.9 ccd LHS5341 18 43 07.0 −54 36 48 9.5 3.0 11 8.7 1.4 12 ... ... ... 8.7 ccd LTT07419 18 43 12.5 −33 22 46 12.1 3.3 8 13.3 2.2 12 15.3 0.6 1 15.3 trg SCR1845-6357 18 45 05.3 −63 57 48 [3.5] 1.2 6 [4.6] 0.8 10 3.9 0.0 2 3.9 trg LTT07434 18 45 57.5 −28 55 53 [8.3] 8.1 10 [11.6] 1.8 12 ... ... ... [11.6] ccd SCR1847-1922 18 47 16.7 −19 22 21 23.0 6.6 11 20.6 3.2 12 ... ... ... 20.6 ccd LTT07452 18 48 01.3 −14 34 51 10.7 4.2 11 16.5 2.6 12 ... ... ... 16.5 ccd SCR1848-6855 18 48 21.0 −68 55 34 [39.0] 16.8 11 [37.3] 10.3 12 24.6 0.4 1 24.6 trg LHS3411 18 48 38.7 −61 35 26 18.6 5.0 11 ... ... ... ... ... ... 18.6 plt L345-091 18 48 41.4 −46 47 08 [10.1] 3.8 11 [12.0] 1.9 12 ... ... ... [12.0] ccd SIP1848-8214 18 48 51.1 −82 14 42 13.5 5.7 11 13.8 2.2 12 ... ... ... 13.8 ccd LP691-015 18 49 06.4 −03 15 18 11.1 5.8 11 14.8 2.3 12 ... ... ... 14.8 ccd GJ0729 18 49 49.4 −23 50 11 3.2 1.7 11 4.1 0.7 12 3.0 0.0 2 3.0 trg LHS3413 18 49 51.2 −57 26 49 11.2 4.0 11 9.9 1.6 12 12.2 0.3 1 12.2 trg 2MA1849-0134 18 49 55.4 −01 34 09 24.1 10.9 11 ... ... ... ... ... ... 24.1 plt LHS3418 18 52 00.2 −60 46 11 19.2 5.3 11 ... ... ... ... ... ... 19.2 plt L489-043 18 52 25.3 −37 30 36 15.5 4.9 11 11.1 1.9 12 ... ... ... 11.1 ccd GJ0732 18 53 39.9 −38 36 45 15.4 4.5 11 11.5 1.8 12 ... ... ... 11.5 ccd L077-046 18 55 14.7 −71 15 03 20.6 6.3 11 ... ... ... ... ... ... 20.6 plt SCR1855-6914 18 55 47.9 −69 14 15 12.5 4.5 11 10.7 1.7 12 ... ... ... 10.7 ccd SCR1856-4704 18 56 38.4 −47 04 58 [21.4] 6.2 11 [22.6] 3.6 12 ... ... ... [22.6] ccd SCR1856-4011 18 57 01.1 −40 11 51 [28.9] 10.0 11 [21.0] 6.0 11 ... ... ... [21.0] ccd GJ0737 18 57 30.6 −55 59 30 [5.8] 1.6 11 [7.8] 1.2 11 12.4 0.3 2 12.4 trg GJ0739 18 59 07.5 −48 16 28 10.8 3.8 11 11.5 1.8 12 14.2 0.5 3 14.2 trg L159-126 18 59 40.7 −63 27 22 16.8 5.0 11 ... ... ... ... ... ... 16.8 plt SCR1901-0737 19 01 32.4 −07 37 24 22.4 6.5 11 18.5 2.9 12 ... ... ... 18.5 ccd SCR1901-3106 19 01 59.2 −31 06 45 28.7 10.6 11 15.7 5.0 12 ... ... ... 15.7 ccd GJ0741 19 03 16.7 −13 34 05 34.2 15.6 11 24.8 5.4 12 19.1 1.4 1 19.1 trg SCR1904-2406 19 04 21.8 −24 06 16 22.3 6.7 11 22.6 3.6 12 ... ... ... 22.6 ccd L274-159 19 05 20.3 −54 34 43 19.0 5.9 11 ... ... ... ... ... ... 19.0 plt L490-020 19 08 22.1 −37 05 28 23.7 6.6 11 ... ... ... ... ... ... 23.7 plt SIP1910-4132 19 10 34.6 −41 33 45 22.8 6.1 11 ... ... ... ... ... ... 22.8 plt L346-096 19 11 04.1 −47 39 14 20.1 5.9 11 ... ... ... ... ... ... 20.1 plt GJ0747.4 19 12 25.3 −55 52 08 17.6 5.2 11 21.4 3.5 12 21.4 1.5 2 21.4 trg WIS1912-3615 19 12 39.3 −36 14 57 25.6 7.8 11 19.3 3.7 12 ... ... ... 19.3 ccd SCR1913-2312 19 13 06.1 −23 12 05 26.0 9.1 11 20.8 3.2 12 ... ... ... 20.8 ccd LHS3443 19 13 08.0 −39 01 54 13.3 4.2 11 15.0 2.3 12 20.6 0.6 1 20.6 trg LP868-019 19 16 35.6 −25 38 42 22.7 6.1 11 ... ... ... ... ... ... 22.7 plt GJ0750 19 16 42.9 −45 53 22 [8.2] 2.5 11 [10.1] 1.7 11 15.5 0.5 2 15.5 trg SCR1918-4554 19 18 29.5 −45 54 30 25.9 9.4 11 20.9 3.5 12 ... ... ... 20.9 ccd L160-005 19 19 41.2 −59 55 20 18.8 6.2 11 ... ... ... ... ... ... 18.8 plt GJ0754 19 20 48.0 −45 33 30 7.9 2.2 11 6.8 1.1 12 5.9 0.1 2 5.9 trg LHS0475 19 20 54.3 −82 33 16 11.8 4.3 11 13.0 2.0 12 12.0 0.1 1 12.0 trg SCR1922-3503 19 22 05.6 −35 03 45 28.3 8.4 11 22.2 3.6 12 ... ... ... 22.2 ccd SCR1924-0931 19 24 11.0 −09 31 34 24.5 6.6 11 23.6 3.8 12 ... ... ... 23.6 ccd

– 94 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

SCR1927-0409 19 27 13.0 −04 09 49 20.5 8.4 11 20.8 3.3 12 ... ... ... 20.8 ccd LHS5348 19 27 52.7 −28 11 15 [14.7] 4.5 11 [11.6] 1.9 12 ... ... ... [11.6] ccd L045-006 19 29 38.3 −74 44 42 14.4 6.6 11 17.5 2.7 12 ... ... ... 17.5 ccd L078-093 19 31 01.4 −73 37 06 18.9 8.6 11 ... ... ... ... ... ... 18.9 plt SCR1931-0306 19 31 04.6 −03 06 18 21.8 6.6 11 17.9 3.0 12 ... ... ... 17.9 ccd L348-141 19 31 53.2 −48 33 54 24.8 8.2 11 ... ... ... ... ... ... 24.8 plt SCR1932-5005 19 32 48.6 −50 05 39 24.4 7.8 11 23.5 3.6 12 ... ... ... 23.5 ccd L275-026 19 34 03.9 −52 25 14 15.6 5.1 11 15.0 2.3 12 ... ... ... 15.0 ccd LP869-042 19 39 36.2 −26 45 07 11.6 4.2 11 16.0 2.7 12 23.2 1.0 1 23.2 trg LP869-019 19 42 00.7 −21 04 06 12.1 3.4 11 10.5 1.6 12 ... ... ... 10.5 ccd L420-142 19 42 53.3 −44 06 28 22.7 6.4 11 ... ... ... ... ... ... 22.7 plt 2MA1943-3722 19 43 24.7 −37 22 11 15.9 4.4 11 ... ... ... ... ... ... 15.9 plt LP925-037 19 43 51.8 −32 24 04 14.6 4.7 11 13.4 3.5 12 ... ... ... 13.4 ccd LP869-026 19 44 53.8 −23 37 59 [11.0] 3.2 11 [10.4] 1.7 12 ... ... ... [10.4] ccd LHS3484 19 47 04.5 −71 05 33 24.7 6.7 11 24.7 3.9 12 ... ... ... 24.7 ccd SCR1947-7646 19 47 14.7 −76 46 55 27.0 10.4 11 22.2 3.5 12 ... ... ... 22.2 ccd WT2180 19 48 22.7 −08 22 52 20.6 5.9 11 ... ... ... ... ... ... 20.6 plt 2MA1951-3510 19 51 35.9 −35 10 38 [13.0] 3.9 11 [11.0] 2.0 12 ... ... ... [11.0] ccd 2MA1951-4025 19 51 36.0 −40 25 21 23.4 6.8 11 ... ... ... ... ... ... 23.4 plt LP870-054 19 52 41.6 −24 46 02 23.8 8.2 11 ... ... ... ... ... ... 23.8 plt L160-159 19 54 04.1 −64 38 10 22.8 6.3 11 ... ... ... ... ... ... 22.8 plt LP926-055 19 54 24.9 −31 47 60 17.2 4.8 11 ... ... ... ... ... ... 17.2 plt LEHPM2-4639 19 56 06.6 −54 42 54 21.9 7.5 11 ... ... ... ... ... ... 21.9 plt LP754-008 19 57 52.0 −10 53 05 18.9 5.6 11 16.0 2.5 12 ... ... ... 16.0 ccd SCR1959-3631 19 59 21.0 −36 31 04 19.8 5.4 8 25.0 4.3 10 ... ... ... 25.0 ccd SCR1959-6236 19 59 33.6 −62 36 13 24.4 7.2 11 21.8 3.4 12 ... ... ... 21.8 ccd DEN2002-5425 20 02 13.4 −54 25 56 17.3 4.8 11 ... ... ... ... ... ... 17.3 plt LHS3514 20 03 58.9 −08 07 47 13.5 4.5 11 14.5 2.2 12 ... ... ... 14.5 ccd GJ0774 20 04 04.7 −65 36 01 [13.7] 3.6 3 14.8 2.3 12 13.1 1.1 2 13.1 trg LHS3516 20 04 06.8 −31 41 48 19.0 5.6 11 ... ... ... ... ... ... 19.0 plt LP870-065 20 04 30.8 −23 42 02 11.1 3.2 11 10.7 1.7 12 ... ... ... 10.7 ccd GJ0781.1 20 07 45.0 −31 45 14 10.8 2.9 11 12.5 2.2 12 15.6 1.1 2 15.6 trg LEHPM2-0064 20 07 55.2 −42 05 15 13.6 4.6 11 13.0 2.0 12 ... ... ... 13.0 ccd LTT07959 20 07 57.6 −01 32 28 24.3 6.6 11 ... ... ... ... ... ... 24.3 plt LHS3525 20 08 07.5 −52 44 25 21.0 5.6 11 ... ... ... ... ... ... 21.0 plt WT0682 20 08 23.8 −55 21 26 23.4 11.1 11 ... ... ... ... ... ... 23.4 plt 2MA2009-0113 20 09 18.2 −01 13 38 14.0 4.4 11 10.8 1.8 12 10.4 0.2 1 10.4 trg L349-063 20 09 51.6 −47 31 34 19.6 5.5 11 ... ... ... ... ... ... 19.6 plt LTT07991 20 11 06.7 −02 30 10 19.9 7.3 11 ... ... ... ... ... ... 19.9 plt GJ0784 20 13 53.4 −45 09 51 4.8 1.3 11 6.0 1.0 9 6.2 0.0 2 6.2 trg LP754-031 20 13 59.5 −11 14 55 24.8 6.9 11 ... ... ... ... ... ... 24.8 plt LHS3534 20 14 15.3 −54 49 15 24.1 6.4 11 ... ... ... ... ... ... 24.1 plt L209-071 20 15 22.7 −56 45 54 13.5 3.9 11 12.6 2.0 12 ... ... ... 12.6 ccd SCR2016-7531 20 16 11.3 −75 31 05 16.2 4.8 11 14.3 2.3 12 ... ... ... 14.3 ccd SCR2018-3635 20 18 06.5 −36 35 28 20.7 6.9 11 24.9 4.0 12 ... ... ... 24.9 ccd LP814-065 20 18 14.6 −20 12 48 22.2 6.0 11 ... ... ... ... ... ... 22.2 plt LEHPM2-0783 20 19 49.8 −58 16 43 10.9 3.0 11 10.6 1.7 12 16.2 0.3 1 16.2 trg

– 95 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP927-008 20 20 43.6 −28 06 07 22.1 6.0 11 17.7 2.8 12 ... ... ... 17.7 ccd 2MA2022-3653 20 22 01.8 −36 53 02 21.3 6.6 11 ... ... ... ... ... ... 21.3 plt GJ0788.1 20 22 41.9 −58 17 09 15.0 4.3 11 21.5 3.5 9 19.4 0.7 2 19.4 trg SCR2025-1534 20 25 08.6 −15 34 16 21.0 6.1 11 18.9 3.0 12 ... ... ... 18.9 ccd SCR2025-2259 20 25 18.9 −22 59 06 23.5 7.0 11 24.6 3.9 12 ... ... ... 24.6 ccd SCR2025-3545 20 25 30.0 −35 45 46 17.8 5.1 11 20.1 3.2 12 ... ... ... 20.1 ccd SCR2025-4207 20 25 41.3 −42 07 31 25.4 7.8 11 23.3 3.9 12 ... ... ... 23.3 ccd LP927-017 20 25 51.6 −26 57 19 23.4 6.7 11 ... ... ... ... ... ... 23.4 plt LEHPM2-0285 20 27 07.1 −44 21 29 24.1 7.1 11 ... ... ... ... ... ... 24.1 plt L210-011 20 27 37.3 −54 52 59 15.1 4.0 11 ... ... ... ... ... ... 15.1 plt GJ0791 20 27 41.7 −27 44 52 12.3 3.4 11 11.1 1.8 12 14.7 0.6 2 14.7 trg GJ1252 20 27 42.1 −56 27 25 20.0 5.5 11 22.3 3.5 12 19.8 0.8 1 19.8 trg GJ1251 20 28 03.7 −76 40 16 16.5 4.7 11 16.4 3.0 12 12.7 0.4 1 12.7 trg L755-019 20 28 43.6 −11 28 31 12.1 4.4 8 12.0 1.9 12 18.8 0.6 1 18.8 trg L080-175 20 29 06.9 −74 21 12 24.5 7.0 11 ... ... ... ... ... ... 24.5 plt LEHPM2-1265 20 33 01.9 −49 03 11 16.5 6.4 11 13.3 2.1 12 ... ... ... 13.3 ccd LP755-027 20 33 32.3 −09 59 05 25.0 6.8 11 ... ... ... ... ... ... 25.0 plt LP567-063 20 34 31.1 −32 31 00 11.8 3.8 11 14.5 2.3 12 ... ... ... 14.5 ccd L162-190 20 34 52.9 −63 47 46 21.4 5.9 11 ... ... ... ... ... ... 21.4 plt LHS3566 20 39 23.8 −29 26 35 16.8 5.6 11 15.5 2.6 12 17.5 0.8 1 17.5 trg SCR2040-5501 20 40 12.4 −55 01 26 22.0 6.4 11 23.2 3.6 12 ... ... ... 23.2 ccd L567-074 20 42 43.4 −32 55 18 18.8 5.3 11 ... ... ... ... ... ... 18.8 plt LP695-372 20 42 45.2 −05 00 19 19.8 5.9 11 ... ... ... ... ... ... 19.8 plt GJ0800 20 42 57.2 −18 55 06 12.3 3.4 11 14.6 2.5 12 17.7 0.7 2 17.7 trg GJ0803 20 45 09.5 −31 20 27 4.2 1.1 11 5.3 0.9 12 9.9 0.1 4 9.9 trg LHS3580 20 45 45.4 −29 27 29 18.9 5.1 11 ... ... ... ... ... ... 18.9 plt LHS3583 20 46 37.1 −81 43 14 10.6 2.9 11 10.8 1.7 12 10.6 0.3 1 10.6 trg LP756-003 20 46 43.6 −11 48 13 17.8 5.4 11 14.6 2.3 12 18.7 0.5 1 18.7 trg LHS3585 20 47 22.6 −25 47 07 23.7 6.2 11 ... ... ... ... ... ... 23.7 plt SIP2049-1716 20 49 52.7 −17 16 08 22.1 8.6 11 ... ... ... ... ... ... 22.1 plt LEP2050-3424 20 50 16.2 −34 24 43 13.9 5.4 11 9.4 1.5 12 ... ... ... 9.4 ccd GJ0808 20 51 41.6 −79 18 40 16.7 4.6 11 21.7 3.3 12 17.5 0.6 2 17.5 trg LP816-060 20 52 33.0 −16 58 29 7.3 2.7 11 5.4 0.8 12 5.7 0.1 1 5.7 trg 2MA2053-0133 20 53 09.1 −01 33 04 47.5 12.4 3 18.7 3.0 12 18.2 0.7 1 18.2 trg LP636-019 20 53 14.7 −02 21 22 25.0 8.5 8 ... ... ... ... ... ... 25.0 plt LEHPM1-3996 20 53 28.0 −73 08 10 21.8 5.7 11 ... ... ... ... ... ... 21.8 plt LEHPM2-5514 20 54 15.0 −53 29 56 22.3 6.2 11 ... ... ... ... ... ... 22.3 plt GJ0810 20 55 37.8 −14 02 08 [9.5] 2.8 11 [10.3] 1.8 12 12.9 0.1 3 12.9 trg LP636-060 20 56 04.1 −02 12 20 22.4 6.0 11 ... ... ... ... ... ... 22.4 plt LP872-027 20 56 27.2 −24 00 13 19.3 5.9 11 17.3 2.7 12 ... ... ... 17.3 ccd GJ0811.1 20 56 46.6 −10 26 55 12.9 3.8 11 11.3 1.9 12 15.9 0.7 2 15.9 trg L424-030 21 00 54.9 −41 31 44 18.7 6.4 11 ... ... ... ... ... ... 18.7 plt APM2101-4125 21 01 03.8 −41 14 33 20.8 6.4 11 ... ... ... ... ... ... 20.8 plt WT0766 21 01 07.4 −49 07 25 18.0 5.3 11 ... ... ... ... ... ... 18.0 plt GJ0816 21 01 58.6 −06 19 08 12.1 5.2 5 10.9 1.7 12 14.4 0.5 2 14.4 trg L163-023 21 02 25.0 −60 31 36 12.0 5.3 11 21.0 3.7 12 ... ... ... 21.0 ccd LTT08345 21 02 40.7 −18 31 17 20.2 5.5 11 ... ... ... ... ... ... 20.2 plt

– 96 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

GJ2151 21 03 13.9 −56 57 48 13.7 3.8 11 15.1 2.3 12 13.3 1.0 2 13.3 trg LHS3615 21 03 21.7 −50 22 52 20.1 5.6 11 17.4 2.8 12 ... ... ... 17.4 ccd GJ0817 21 04 53.4 −16 57 32 18.2 5.0 11 23.2 3.6 12 17.9 0.8 2 17.9 trg L281-046 21 04 53.9 −52 48 34 22.1 6.4 11 24.5 3.8 12 ... ... ... 24.5 ccd LEHPM2-0801 21 05 13.8 −55 03 56 17.1 4.8 11 16.7 2.9 12 ... ... ... 16.7 ccd L280-056 21 06 26.9 −51 42 37 21.6 5.7 11 ... ... ... ... ... ... 21.6 plt APM2109-4003 21 08 31.3 −40 03 49 24.7 6.7 11 24.5 3.8 12 ... ... ... 24.5 ccd GJ0821 21 09 17.4 −13 18 09 13.3 3.6 11 16.8 2.6 12 12.2 0.3 2 12.2 trg LP873-009 21 11 13.7 −22 48 18 18.7 6.3 11 17.5 2.8 12 ... ... ... 17.5 ccd LP757-092 21 11 24.2 −09 40 33 20.0 6.1 11 15.4 2.5 12 ... ... ... 15.4 ccd LHS3639 21 11 49.6 −43 36 49 19.4 5.4 11 19.4 3.0 12 15.8 0.9 2 15.8 trg WT2203 21 14 14.0 −07 02 50 19.5 5.5 11 ... ... ... ... ... ... 19.5 plt GJ0825 21 17 15.3 −38 52 03 2.7 0.7 11 3.7 0.6 8 4.0 0.0 2 4.0 trg L117-123 21 20 09.8 −67 39 06 11.4 3.1 11 15.6 2.6 12 20.8 0.9 3 20.8 trg SCR2122-4314 21 22 16.9 −43 14 05 17.0 4.7 11 14.9 2.3 12 ... ... ... 14.9 ccd GJ0826.2 21 24 18.4 −46 41 35 22.6 6.1 11 24.3 3.8 12 24.5 2.7 2 24.5 trg APM2127-3844 21 27 04.6 −38 44 51 22.3 6.2 11 21.4 3.5 12 20.3 0.6 1 20.3 trg GJ0828.2 21 27 16.9 −06 50 39 17.7 5.0 7 19.7 3.2 12 16.4 0.6 2 16.4 trg HB2124-4228 21 27 26.1 −42 15 18 29.3 10.6 11 27.1 4.2 7 23.6 2.0 1 23.6 trg LTT08524 21 27 58.5 −00 39 50 24.1 6.7 11 ... ... ... ... ... ... 24.1 plt L714-046 21 28 18.3 −22 18 32 18.7 5.0 11 17.0 2.7 12 ... ... ... 17.0 ccd LP817-050 21 28 41.1 −14 31 04 24.9 6.8 11 ... ... ... ... ... ... 24.9 plt LP817-054 21 29 23.4 −18 55 08 22.6 7.4 11 ... ... ... ... ... ... 22.6 plt SCR2130-7710 21 30 07.0 −77 10 38 22.0 9.1 11 18.3 2.9 12 ... ... ... 18.3 ccd LHS0510 21 30 47.7 −40 42 30 15.7 4.3 11 15.8 2.8 12 12.0 0.4 1 12.0 trg GJ0831 21 31 18.6 −09 47 26 [6.2] 1.9 11 [4.8] 0.8 12 8.0 0.1 2 8.0 trg LP698-002 21 32 29.8 −05 11 59 22.9 7.5 11 ... ... ... ... ... ... 22.9 plt GJ0832 21 33 34.0 −49 00 33 5.2 1.5 11 5.1 0.8 12 5.0 0.0 2 5.0 trg LHS3689 21 33 48.9 −06 51 10 21.7 7.0 11 ... ... ... ... ... ... 21.7 plt L164-131 21 34 03.8 −63 11 07 23.6 6.3 11 ... ... ... ... ... ... 23.6 plt WT0792 21 34 22.3 −43 16 11 17.2 5.2 11 13.2 2.1 12 ... ... ... 13.2 ccd L164-124 21 34 52.2 −63 01 08 22.0 6.6 11 ... ... ... ... ... ... 22.0 plt SIP2135-3855 21 35 16.2 −38 55 48 25.7 7.6 11 23.3 3.6 12 ... ... ... 23.3 ccd SCR2135-5325 21 35 39.6 −53 25 32 20.8 6.7 11 20.7 3.6 12 ... ... ... 20.7 ccd WT0795 21 36 25.3 −44 01 00 15.5 4.4 11 13.1 2.1 12 14.4 0.1 1 14.4 trg HIP106803 21 37 55.7 −63 42 43 11.5 3.3 11 14.8 2.5 12 21.3 1.2 1 21.3 trg LHS0512 21 38 43.7 −33 39 55 12.7 3.9 11 12.4 1.9 12 12.2 0.3 1 12.2 trg GJ0836 21 39 00.9 −24 09 29 17.4 4.8 11 16.2 2.5 12 ... ... ... 16.2 ccd L081-009 21 41 03.8 −69 45 35 22.0 5.8 11 ... ... ... ... ... ... 22.0 plt LTT08678 21 45 00.8 −05 47 13 24.2 6.8 11 ... ... ... ... ... ... 24.2 plt LP874-061 21 45 26.7 −21 33 58 23.3 6.7 11 ... ... ... ... ... ... 23.3 plt L002-077 21 46 40.4 −85 43 05 18.2 5.2 11 11.4 1.8 12 ... ... ... 11.4 ccd GJ1263 21 46 42.7 −00 10 24 11.0 3.0 11 10.8 1.7 12 12.0 0.6 1 12.0 trg LP874-062 21 46 45.5 −21 17 47 15.9 4.3 11 15.0 2.3 12 ... ... ... 15.0 ccd LP698-042 21 47 17.5 −04 44 41 18.7 6.9 11 ... ... ... ... ... ... 18.7 plt LP818-034 21 48 53.0 −19 47 27 19.0 5.6 11 17.4 2.7 12 ... ... ... 17.4 ccd GJ1264 21 49 05.9 −72 06 08 [7.3] 2.1 11 [9.4] 1.6 12 16.3 0.4 1 16.3 trg

– 97 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L427-034 21 49 11.4 −41 33 30 [12.5] 3.4 11 [11.4] 2.0 12 ... ... ... [11.4] ccd LHS3719 21 49 25.9 −63 06 52 17.2 4.8 11 17.2 2.7 12 16.6 0.4 1 16.6 trg WT0818 21 49 44.8 −41 38 33 19.8 5.6 11 19.1 3.0 12 ... ... ... 19.1 ccd LP638-050 21 51 27.0 −01 27 14 22.2 6.4 11 ... ... ... ... ... ... 22.2 plt SCR2154-4754 21 54 02.5 −47 54 02 26.9 7.7 11 24.0 3.8 12 ... ... ... 24.0 ccd LP818-054 21 55 02.2 −20 14 27 23.4 6.4 11 ... ... ... ... ... ... 23.4 plt LP983-034 21 55 48.4 −33 13 15 15.5 4.1 11 ... ... ... ... ... ... 15.5 plt LP758-062 21 56 19.8 −10 20 17 18.7 5.3 11 18.0 3.0 12 ... ... ... 18.0 ccd LHS0516 21 56 55.3 −01 54 09 20.7 5.9 11 16.3 2.7 12 13.4 0.6 1 13.4 trg LP759-006 21 57 12.7 −09 03 27 16.1 5.1 11 15.3 2.4 12 ... ... ... 15.3 ccd LHS3735 21 57 39.3 −09 28 13 22.2 6.9 11 25.0 3.9 12 ... ... ... 25.0 ccd LHS3739 21 58 50.2 −32 28 18 31.5 10.7 11 27.6 4.5 12 19.6 0.3 2 19.6 trg GJ0842 21 59 34.7 −59 45 10 8.4 2.3 11 9.9 1.6 12 12.0 0.3 2 12.0 trg GJ0843 22 02 00.8 −19 28 59 13.4 3.6 11 11.4 1.8 12 ... ... ... 11.4 ccd LP759-017 22 02 11.3 −11 09 46 24.1 8.7 11 ... ... ... ... ... ... 24.1 plt LHS3746 22 02 29.4 −37 04 51 9.7 2.9 11 8.1 1.3 12 7.5 0.1 1 7.5 trg LTT18559 22 02 31.3 −00 17 10 24.4 7.7 11 ... ... ... ... ... ... 24.4 plt LP875-009 22 03 20.0 −25 21 52 22.7 6.2 11 ... ... ... ... ... ... 22.7 plt LHS3748 22 03 27.1 −50 38 38 16.0 4.3 11 21.2 3.3 12 19.9 1.7 1 19.9 trg LP759-025 22 05 35.7 −11 04 29 22.3 6.7 11 ... ... ... ... ... ... 22.3 plt LTT08848 22 05 51.3 −11 54 51 11.1 3.1 11 14.8 2.6 10 22.2 1.3 1 22.2 trg LHS3756 22 05 54.4 −38 16 06 21.9 6.0 11 ... ... ... ... ... ... 21.9 plt LP699-032 22 06 09.6 −07 23 36 17.0 4.9 11 ... ... ... ... ... ... 17.0 plt WT0870 22 06 40.7 −44 58 07 17.2 5.4 11 16.0 2.5 12 17.7 0.4 1 17.7 trg L283-001 22 06 57.2 −49 49 42 18.4 5.0 11 ... ... ... ... ... ... 18.4 plt LP983-102 22 07 53.9 −37 04 24 23.0 6.1 11 ... ... ... ... ... ... 23.0 plt LP1032-066 22 08 16.2 −42 42 59 19.9 5.6 11 22.7 3.5 12 ... ... ... 22.7 ccd LTT08875 22 08 32.4 −08 24 52 19.3 5.5 11 ... ... ... ... ... ... 19.3 plt L024-098 22 08 38.6 −83 03 29 21.9 6.8 11 ... ... ... ... ... ... 21.9 plt GJ0849 22 09 40.3 −04 38 27 5.2 1.4 11 5.7 0.9 12 9.0 0.1 2 9.0 trg LEHPM1-4416 22 10 13.2 −71 46 07 18.3 5.3 11 19.4 3.2 12 ... ... ... 19.4 ccd LTT08900 22 11 13.5 −02 32 37 16.0 5.8 11 ... ... ... ... ... ... 16.0 plt LTT08905 22 11 56.9 −07 42 57 22.3 6.3 11 ... ... ... ... ... ... 22.3 plt LTT08914 22 13 28.8 −14 44 54 20.2 6.2 11 21.9 3.5 12 ... ... ... 21.9 ccd GJ1265 22 13 42.9 −17 41 09 13.6 4.5 11 11.8 1.8 12 10.4 0.4 1 10.4 trg WT0887 22 13 50.5 −63 42 10 16.3 5.6 11 ... ... ... ... ... ... 16.3 plt LP875-068 22 14 38.4 −21 41 53 14.2 4.0 10 18.1 3.1 10 ... ... ... 18.1 ccd LP984-001 22 17 19.0 −34 44 03 15.0 4.6 11 12.4 1.9 12 ... ... ... 12.4 ccd GJ0852 22 17 19.2 −08 48 13 [23.4] 7.7 8 13.5 2.3 12 10.0 0.3 1 10.0 trg LHS3789 22 17 53.3 −36 11 20 22.6 6.1 11 ... ... ... ... ... ... 22.6 plt LHS3793 22 19 23.7 −28 23 21 23.3 6.6 11 ... ... ... ... ... ... 23.3 plt LP931-042 22 20 24.7 −27 05 52 24.7 8.7 11 ... ... ... ... ... ... 24.7 plt LHS5384 22 21 49.7 −42 09 03 21.9 6.1 11 21.6 3.3 12 ... ... ... 21.6 ccd LP931-048 22 21 53.4 −31 31 23 20.0 5.4 11 ... ... ... ... ... ... 20.0 plt LEHPM1-4635 22 22 43.5 −72 15 44 22.9 6.6 11 ... ... ... ... ... ... 22.9 plt LHS3799 22 23 07.0 −17 36 26 8.5 3.0 11 6.1 0.9 12 7.3 0.1 2 7.3 trg LP931-053 22 23 14.0 −27 23 58 18.4 6.1 11 ... ... ... ... ... ... 18.4 plt

– 98 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

GJ0855 22 23 33.3 −57 13 14 13.2 3.6 11 15.4 2.5 12 19.1 0.8 2 19.1 trg LP931-057 22 23 46.3 −28 06 50 [22.5] 6.1 11 ... ... ... ... ... ... [22.5] plt LP1033-011 22 24 56.7 −38 31 10 24.3 6.8 11 ... ... ... ... ... ... 24.3 plt LHS3804 22 25 05.1 −47 52 47 12.9 3.7 11 10.9 1.8 12 ... ... ... 10.9 ccd LEHPM1-4728 22 27 27.1 −35 00 51 23.5 6.2 11 ... ... ... ... ... ... 23.5 plt LP876-026 22 28 23.4 −25 54 08 [14.1] 3.8 11 [15.1] 3.6 12 20.4 1.0 1 20.4 trg LHS0523 22 28 54.4 −13 25 19 14.8 4.4 11 14.3 4.4 12 11.3 0.4 1 11.3 trg LEHPM1-4771 22 30 09.5 −53 44 56 12.3 3.6 11 12.0 1.8 12 ... ... ... 12.0 ccd SCR2230-5244 22 30 28.0 −52 44 29 26.4 11.1 11 24.8 4.2 12 ... ... ... 24.8 ccd LP876-034 22 34 00.5 −25 14 33 10.0 2.7 11 13.0 2.0 12 16.1 0.8 1 16.1 trg L166-044 22 34 04.6 −61 07 41 18.9 5.5 11 ... ... ... ... ... ... 18.9 plt LHS0526 22 34 53.7 −01 04 58 27.6 12.8 11 24.5 3.9 12 23.5 2.1 1 23.5 trg LTT09084 22 35 04.9 −42 17 48 14.9 4.1 11 15.1 2.4 12 ... ... ... 15.1 ccd GJ0864 22 36 09.7 −00 50 30 11.2 3.1 4 12.9 2.2 12 17.0 0.5 2 17.0 trg L645-074 22 38 24.7 −29 21 14 12.6 3.8 11 11.5 1.8 12 ... ... ... 11.5 ccd GJ0865 22 38 29.8 −65 22 42 [8.1] 2.5 11 [6.9] 1.1 12 12.8 0.9 2 12.8 trg GJ0866 22 38 33.6 −15 17 59 [3.5] 2.2 11 [1.9] 0.3 12 3.5 0.1 1 3.5 trg GJ0867 22 38 45.6 −20 37 16 [4.4] 1.1 3 [5.4] 0.9 12 8.7 0.1 2 8.7 trg L083-030 22 40 42.9 −71 31 11 17.9 5.4 11 ... ... ... ... ... ... 17.9 plt LHS3844 22 41 58.1 −69 10 08 15.5 4.5 11 ... ... ... ... ... ... 15.5 plt LEHPM1-5031 22 41 59.4 −75 00 33 17.0 5.3 11 ... ... ... ... ... ... 17.0 plt L166-003 22 42 00.1 −59 15 13 19.3 5.7 11 ... ... ... ... ... ... 19.3 plt LP820-060 22 43 02.0 −20 07 18 20.8 6.2 11 ... ... ... ... ... ... 20.8 plt LP876-008 22 43 23.1 −24 24 52 19.5 5.6 11 ... ... ... ... ... ... 19.5 plt GJ0871.1 22 44 58.0 −33 15 02 11.1 3.7 11 7.9 1.3 12 22.8 1.2 2 22.8 trg G156-046 22 45 06.1 −12 23 43 23.4 8.0 11 ... ... ... ... ... ... 23.4 plt LP821-016 22 46 23.8 −16 56 53 25.0 7.4 11 24.3 3.8 12 ... ... ... 24.3 ccd LHS3850 22 46 26.4 −06 39 26 25.9 10.7 11 ... ... ... 18.8 1.6 1 18.8 trg GJ0874 22 48 17.4 −36 47 23 20.0 5.6 11 19.8 3.1 12 ... ... ... 19.8 ccd LP932-081 22 48 38.4 −31 08 41 14.5 3.8 11 13.3 2.1 12 ... ... ... 13.3 ccd LP932-083 22 49 08.4 −28 51 20 16.9 4.6 11 13.7 2.1 12 ... ... ... 13.7 ccd LP985-032 22 51 23.7 −34 19 36 20.7 6.0 7 21.7 3.4 12 ... ... ... 21.7 ccd LP821-027 22 52 05.2 −15 32 51 26.8 10.4 11 18.0 2.8 12 ... ... ... 18.0 ccd SCR2252-6905 22 52 19.2 −69 05 48 26.0 7.5 11 24.3 3.8 12 ... ... ... 24.3 ccd SCR2252-2220 22 52 25.8 −22 20 07 21.3 5.7 11 24.2 3.7 12 ... ... ... 24.2 ccd LHS5394 22 52 48.1 −28 47 43 16.9 5.3 11 19.0 3.0 12 19.6 1.1 1 19.6 trg GJ0876 22 53 16.8 −14 15 49 3.8 1.2 11 3.5 0.5 12 4.7 0.0 3 4.7 trg SCR2253-1238 22 53 42.8 −12 38 43 23.4 6.6 11 22.9 3.8 12 ... ... ... 22.9 ccd LEHPM1-5263 22 53 50.9 −71 28 07 19.9 6.0 11 ... ... ... ... ... ... 19.9 plt LHS3872 22 54 46.5 −05 28 26 24.9 6.8 11 20.5 3.2 12 23.6 2.5 2 23.6 trg HIP113201 22 55 27.2 −52 18 10 16.9 4.6 11 20.2 3.3 12 24.8 1.8 1 24.8 trg GJ0877 22 55 45.5 −75 27 31 6.2 1.7 11 7.1 1.1 12 8.6 0.1 2 8.6 trg GJ1277 22 56 24.7 −60 03 49 9.1 2.6 11 9.0 1.4 12 10.3 0.1 1 10.3 trg LP761-006 22 56 26.2 −11 09 39 23.0 8.7 11 ... ... ... ... ... ... 23.0 plt L718-071 23 00 33.4 −23 57 10 15.7 4.7 11 19.4 3.1 12 20.6 0.8 2 20.6 trg LP877-045 23 00 36.7 −26 04 56 23.8 7.3 11 ... ... ... ... ... ... 23.8 plt LP933-037 23 01 23.9 −26 49 47 24.3 7.2 11 ... ... ... ... ... ... 24.3 plt

– 99 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L215-016 23 01 32.5 −55 30 18 15.1 4.5 11 21.5 3.3 12 ... ... ... 21.5 ccd LP701-056 23 01 46.2 −06 14 23 24.2 6.9 11 ... ... ... ... ... ... 24.2 plt L286-074 23 01 49.5 −53 17 08 17.9 5.7 11 ... ... ... ... ... ... 17.9 plt LP821-054 23 03 59.7 −16 12 07 22.8 6.3 11 22.3 3.5 12 ... ... ... 22.3 ccd GJ0887 23 05 52.1 −35 51 11 2.6 1.0 11 3.7 0.7 12 3.3 0.0 2 3.3 trg L1007-017 23 06 27.8 −00 29 38 23.2 6.4 11 ... ... ... ... ... ... 23.2 plt 2MA2306-0502 23 06 29.4 −05 02 29 12.2 3.6 11 11.6 1.8 11 12.1 0.4 1 12.1 trg SSS2307-5009 23 06 58.8 −50 08 59 21.7 11.3 11 27.6 6.5 12 21.5 0.7 1 21.5 trg SCR2307-8452 23 07 19.7 −84 52 04 20.6 5.9 11 20.0 3.3 12 ... ... ... 20.0 ccd LHS3898 23 07 46.8 −27 54 23 18.9 5.6 11 ... ... ... ... ... ... 18.9 plt LTT09381 23 09 39.3 −01 58 24 17.2 4.9 11 ... ... ... ... ... ... 17.2 plt GJ1279 23 09 40.9 −67 43 58 7.5 2.1 8 ... ... ... 15.0 0.2 1 15.0 trg LTT09388 23 10 00.3 −21 11 43 17.2 4.6 11 17.1 2.7 12 ... ... ... 17.1 ccd L120-181 23 10 20.7 −69 12 22 21.3 6.1 11 ... ... ... ... ... ... 21.3 plt GJ1281 23 10 42.2 −19 13 35 22.3 6.1 11 26.8 4.3 12 24.3 1.4 1 24.3 trg LEHPM1-5562 23 10 54.9 −38 02 01 24.9 6.7 11 ... ... ... ... ... ... 24.9 plt LP822-037 23 11 57.8 −17 01 59 18.8 5.1 11 ... ... ... ... ... ... 18.8 plt LHS3909 23 12 11.3 −14 06 12 21.4 6.1 11 19.5 3.1 12 18.2 0.7 1 18.2 trg LTT09412 23 13 01.8 −05 31 10 23.1 6.5 11 ... ... ... ... ... ... 23.1 plt GJ2154 23 14 16.7 −19 38 39 [13.4] 3.7 11 15.5 2.6 12 19.8 0.8 1 19.8 trg LEHPM1-5625 23 15 02.0 −35 28 25 19.5 6.0 11 ... ... ... ... ... ... 19.5 plt LHS3918 23 15 43.8 −12 21 49 23.4 6.4 11 ... ... ... ... ... ... 23.4 plt LHS0539 23 15 51.6 −37 33 31 26.8 7.7 11 24.3 4.0 12 18.9 0.7 1 18.9 trg LP702-050 23 15 54.5 −06 27 46 19.3 5.8 11 ... ... ... ... ... ... 19.3 plt LHS3916 23 15 57.2 −81 22 21 [9.4] 2.8 11 [15.6] 2.6 9 22.5 0.7 1 22.5 trg LTT09448 23 16 36.7 −01 30 48 20.8 6.1 11 ... ... ... ... ... ... 20.8 plt L719-021 23 17 00.2 −23 23 47 17.1 5.3 11 24.5 4.0 9 21.3 0.8 1 21.3 trg LTT09461 23 17 21.8 −25 42 21 24.7 7.2 11 ... ... ... ... ... ... 24.7 plt LTT09462 23 17 25.5 −40 26 46 18.6 5.3 11 21.0 3.4 12 ... ... ... 21.0 ccd LHS3925 23 17 50.3 −48 18 47 20.6 5.6 11 21.9 3.5 12 21.3 0.5 1 21.3 trg G273-014 23 19 35.6 −08 53 17 23.5 7.8 11 ... ... ... ... ... ... 23.5 plt LP642-048 23 20 57.7 −01 47 37 [16.0] 4.5 11 [17.1] 2.7 12 ... ... ... [17.1] ccd LTT09506 23 21 05.7 −16 51 49 21.7 5.7 11 ... ... ... ... ... ... 21.7 plt LP934-033 23 22 23.6 −27 25 45 24.1 7.0 11 ... ... ... ... ... ... 24.1 plt LTT09524 23 24 05.6 −05 11 14 22.3 5.9 11 ... ... ... ... ... ... 22.3 plt LP822-073 23 24 16.9 −15 22 23 21.3 6.3 11 ... ... ... ... ... ... 21.3 plt LP822-074 23 24 29.1 −18 31 15 22.4 6.3 11 ... ... ... ... ... ... 22.4 plt G273-039 23 25 16.0 −12 52 31 24.6 7.7 9 ... ... ... ... ... ... 24.6 plt L120-120 23 25 25.1 −67 40 08 20.0 5.7 11 19.5 3.0 12 ... ... ... 19.5 ccd LHS3954 23 27 26.5 −17 41 33 21.8 6.4 11 ... ... ... ... ... ... 21.8 plt LP986-059 23 27 28.7 −37 54 12 20.9 5.6 11 ... ... ... ... ... ... 20.9 plt LP702-096 23 27 55.5 −05 27 01 24.7 6.7 11 ... ... ... ... ... ... 24.7 plt GJ1284 23 30 13.5 −20 23 27 [8.4] 2.4 11 [7.8] 1.2 12 15.1 0.4 2 15.1 trg APM2330-4737 23 30 16.2 −47 36 45 15.3 4.9 11 13.1 2.1 12 13.8 0.6 1 13.8 trg SCR2330-0838 23 30 16.9 −08 38 37 19.9 6.8 11 22.1 3.4 12 ... ... ... 22.1 ccd LEHPM2-2163 23 30 38.2 −84 55 19 17.8 5.1 11 ... ... ... ... ... ... 17.8 plt DEN2331-2749 23 31 21.8 −27 49 50 12.0 3.8 11 14.3 2.3 10 14.5 0.4 1 14.5 trg

– 100 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LTT09580 23 31 25.0 −16 15 58 16.0 4.4 11 13.6 2.2 12 ... ... ... 13.6 ccd LTT09582 23 32 00.2 −39 17 37 17.3 4.7 11 15.9 2.5 12 ... ... ... 15.9 ccd LTT09596 23 33 36.7 −42 13 22 15.1 4.6 11 15.4 2.6 12 ... ... ... 15.4 ccd GJ1286 23 35 10.5 −02 23 21 10.1 4.3 11 7.0 1.1 12 7.2 0.2 1 7.2 trg G275-071 23 35 48.8 −24 19 09 21.3 6.0 11 ... ... ... ... ... ... 21.3 plt LHS0547 23 36 52.3 −36 28 52 14.7 4.1 11 14.3 2.4 12 11.6 0.3 1 11.6 trg LP763-003 23 37 38.3 −12 50 28 23.6 9.1 11 ... ... ... ... ... ... 23.6 plt L026-054 23 37 52.8 −76 45 26 15.3 6.1 11 ... ... ... ... ... ... 15.3 plt LTT09634 23 38 08.2 −16 14 10 16.0 5.0 8 14.0 2.2 12 ... ... ... 14.0 ccd LTT09635 23 38 17.4 −41 31 04 15.5 4.6 11 16.8 2.7 12 18.7 1.2 1 18.7 trg LEHPM1-6053 23 40 23.9 −40 21 47 17.7 5.1 11 ... ... ... ... ... ... 17.7 plt G275-082 23 41 16.3 −26 57 21 20.5 5.9 11 ... ... ... ... ... ... 20.5 plt LP703-042 23 41 39.3 −06 35 50 21.2 6.1 11 ... ... ... ... ... ... 21.2 plt LEHPM2-1679 23 41 41.6 −85 56 07 22.3 6.7 11 ... ... ... ... ... ... 22.3 plt LEHPM1-6134 23 44 10.9 −68 31 47 20.4 5.9 11 ... ... ... ... ... ... 20.4 plt LEHPM1-6159 23 45 10.6 −38 32 24 20.5 5.5 11 ... ... ... ... ... ... 20.5 plt LHS4009 23 45 31.3 −16 10 20 [13.9] 6.8 11 [9.2] 1.5 12 12.5 0.2 1 12.5 trg LHS4012 23 46 32.0 −50 43 28 22.9 6.8 11 ... ... ... ... ... ... 22.9 plt LP987-023 23 46 38.2 −34 10 02 18.4 4.9 11 20.1 3.1 12 ... ... ... 20.1 ccd GR0481 23 47 37.8 −23 16 06 20.1 6.1 11 ... ... ... ... ... ... 20.1 plt LHS4016 23 48 36.1 −27 39 39 [17.8] 4.7 11 [17.2] 2.7 12 24.2 0.9 1 24.2 trg LHS4021 23 50 31.6 −09 33 33 17.8 5.3 11 11.8 2.0 12 16.0 0.4 1 16.0 trg LEHPM1-6333 23 51 50.5 −25 37 37 [13.4] 6.2 8 [17.2] 2.8 12 ... ... ... [17.2] ccd LEHPM1-6366 23 52 32.2 −34 13 07 24.8 7.7 11 ... ... ... ... ... ... 24.8 plt L217-036 23 52 44.4 −57 56 03 16.9 4.5 11 ... ... ... ... ... ... 16.9 plt LTT09783 23 53 08.3 −42 32 04 23.0 6.3 11 ... ... ... ... ... ... 23.0 plt L085-031 23 53 25.2 −70 56 41 11.5 3.3 11 11.8 1.8 12 ... ... ... 11.8 ccd LP987-047 23 53 41.0 −35 59 06 17.1 4.8 11 ... ... ... ... ... ... 17.1 plt L026-027 23 53 50.1 −75 37 57 7.2 2.0 11 6.7 1.1 12 10.0 0.1 1 10.0 trg LHS4038 23 54 04.3 −41 32 31 20.2 5.4 11 ... ... ... ... ... ... 20.2 plt L169-058 23 54 41.3 −61 35 10 20.6 5.7 11 ... ... ... ... ... ... 20.6 plt LHS4046 23 55 26.0 −03 59 00 24.0 7.0 11 24.5 3.9 12 ... ... ... 24.5 ccd GJ0912 23 55 39.8 −06 08 33 11.6 3.4 11 11.7 1.9 12 18.3 0.9 2 18.3 trg G158-008 23 55 55.2 −13 21 24 19.7 5.3 11 18.0 2.8 12 ... ... ... 18.0 ccd LEHPM1-6494 23 56 10.8 −34 26 05 20.2 9.0 11 22.8 3.8 9 19.1 0.6 1 19.1 trg SCR2356-0429 23 56 20.4 −04 29 32 [21.6] 6.2 11 [22.4] 3.5 12 ... ... ... [22.4] ccd LP987-060 23 57 53.6 −34 07 36 18.5 5.0 11 ... ... ... ... ... ... 18.5 plt LP764-040 23 58 13.7 −17 24 34 12.0 3.4 11 16.0 7.8 12 ... ... ... 16.0 ccd APM2359-6246 23 58 42.9 −62 45 42 24.9 7.4 11 21.8 3.9 12 20.8 1.0 1 20.8 trg LTT09828 23 59 44.8 −44 05 00 [16.4] 4.7 11 [17.6] 2.7 12 ... ... ... [17.6] ccd LHS4058 23 59 51.4 −34 06 43 11.6 3.2 11 12.2 1.9 12 15.8 0.5 1 15.8 trg

GJ1293 00 01 25.8 −16 56 55 16.5 4.6 4 24.8 4.1 9 32.1 2.3 1 32.1 trg L290-032 00 02 27.1 −46 01 44 24.5 6.6 11 ... ... ... 38.4 6.6 1 38.4 trg LHS0105 00 09 17.3 −19 42 32 25.9 7.9 11 29.1 5.1 12 ... ... ... 29.1 ccd LTT00074 00 11 04.6 −05 47 02 16.6 4.6 9 21.0 3.6 10 25.8 1.4 2 25.8 trg

– 101 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LTT00095 00 13 29.1 −36 49 44 13.5 3.7 11 ... ... ... 28.2 2.1 1 28.2 trg LHS1048 00 15 33.5 −35 11 48 40.6 12.1 11 52.6 8.5 12 ... ... ... 52.6 ccd SCR0015-6957 00 15 52.5 −69 57 21 28.1 7.8 11 31.8 5.3 12 ... ... ... 31.8 ccd LHS0109 00 17 40.0 −10 46 17 {71.7} 22.1 11 {103.1} 17.1 9 35.2 4.4 1 35.2 trg LEHPM1-0439 00 18 19.4 −82 07 15 55.3 15.7 11 58.8 11.0 12 ... ... ... 58.8 ccd L086-093 00 18 34.6 −68 46 60 22.6 6.6 11 30.3 4.9 9 ... ... ... 30.3 ccd LP644-095 00 19 12.4 −03 03 13 19.3 5.3 11 ... ... ... 31.0 2.2 1 31.0 trg LHS0110 00 19 37.0 −28 09 46 [51.9] 13.8 3 [49.3] 7.9 12 30.5^a 1.2 2 30.5 trg LEHPM1-0494 00 21 05.9 −42 44 43 34.6 10.1 11 31.7 7.0 12 26.9^a 2.0 2 26.9 trg LTT00207 00 23 47.3 −36 51 41 19.0 7.0 10 ... ... ... 40.2 2.6 1 40.2 trg LHS1094 00 32 15.4 −63 05 28 10.1 2.9 11 ... ... ... 25.1 0.7 2 25.1 trg SCR0033-6317 00 33 02.3 −63 17 50 27.0 9.1 11 25.6 4.6 12 ... ... ... 25.6 ccd LHS1106 00 36 00.0 −09 30 56 22.2 6.6 11 30.5 5.7 10 33.8 2.4 1 33.8 trg SCR0052-6155 00 52 09.9 −61 55 23 28.9 7.6 11 32.6 5.1 12 ... ... ... 32.6 ccd SIP0052-6201 00 52 15.3 −62 01 55 29.3 8.6 11 26.5 5.6 12 ... ... ... 26.5 ccd GJ0043 00 55 25.4 −51 49 58 23.5 7.0 11 25.8 4.1 12 33.0 4.4 2 33.0 trg LTT00525 00 55 49.3 −29 40 34 12.6 3.8 11 ... ... ... 30.5 1.1 2 30.5 trg G270-100 00 56 30.2 −04 25 16 24.6 6.9 11 ... ... ... 30.0 2.9 1 30.0 trg LTT00648 01 09 38.8 −07 10 50 15.0 4.4 11 15.6 2.5 12 37.7 4.1 1 37.7 trg SCR0112-7939 01 12 23.5 −79 39 13 29.3 9.3 11 33.3 5.1 12 ... ... ... 33.3 ccd GJ0056.2 01 17 59.4 −48 09 01 22.2 7.4 11 29.8 5.2 10 34.4 3.3 2 34.4 trg LHS1245 01 24 22.1 −44 08 11 23.0 7.2 11 ... ... ... 33.9 4.7 1 33.9 trg GJ2022 01 24 27.7 −33 55 09 [13.8] 4.4 11 [14.8] 3.0 12 25.8 1.4 1 25.8 trg GJ1038 01 25 01.8 −32 51 04 10.0 3.6 10 ... ... ... 25.1 1.0 1 25.1 trg L222-009 01 35 40.4 −50 15 42 17.9 5.0 11 ... ... ... 48.2 5.7 1 48.2 trg LP939-103 01 36 36.9 −34 23 26 63.1 28.3 11 54.6 8.5 12 ... ... ... 54.6 ccd SCR0138-5353 01 38 20.5 −53 53 26 24.3 7.4 11 29.7 4.5 12 ... ... ... 29.7 ccd SCR0138-7855 01 38 54.0 −78 55 18 [26.7] 7.9 11 [35.3] 5.4 12 ... ... ... [35.3] ccd SCR0139-7536 01 39 27.9 −75 36 14 18.5 6.6 11 26.2 4.1 12 ... ... ... 26.2 ccd LP708-253 01 40 04.8 −13 54 41 17.6 5.6 11 ... ... ... 34.9 4.6 1 34.9 trg L367-082 01 41 03.6 −43 38 10 25.0 7.6 11 ... ... ... 41.8 4.6 1 41.8 trg LHS1288 01 42 55.8 −42 12 13 16.4 4.8 11 23.8 3.7 9 28.4 1.9 2 28.4 trg SCR0143-3840 01 43 03.3 −38 40 08 19.3 5.3 11 25.3 4.1 12 ... ... ... 25.3 ccd L367-008 01 45 21.4 −39 57 20 19.3 5.4 11 ... ... ... 29.6 2.0 1 29.6 trg L173-003 01 51 46.2 −54 57 58 23.4 7.0 11 ... ... ... 47.9 7.9 1 47.9 trg SCR0153-0703 01 53 20.6 −07 03 32 26.6 8.4 11 29.5 4.7 12 ... ... ... 29.5 ccd SCR0153-5000 01 53 24.2 −50 00 04 28.0 7.6 11 36.3 5.9 12 ... ... ... 36.3 ccd L223-102 01 54 39.0 −50 45 58 47.4 12.7 11 66.6 11.2 12 ... ... ... 66.6 ccd LTT01021 01 55 32.2 −15 31 22 25.0 7.0 7 30.6 5.0 10 ... ... ... 30.6 ccd SCR0156-6702 01 56 26.1 −67 02 36 29.7 8.5 11 32.8 5.7 12 ... ... ... 32.8 ccd SCR0201-5739 02 01 38.8 −57 39 36 27.9 9.3 11 40.8 6.8 12 ... ... ... 40.8 ccd L583-033 02 02 17.5 −26 33 52 [30.6] 10.1 8 [35.5] 15.1 11 ... ... ... [35.5] ccd LP649-030 02 03 30.2 −04 54 41 19.5 5.7 11 22.8 4.3 11 28.8 3.0 1 28.8 trg GJ0088 02 12 51.0 −17 41 12 19.6 5.3 7 23.7 3.8 9 26.5 1.9 2 26.5 trg LP941-016 02 13 37.4 −35 12 24 21.1 6.7 10 ... ... ... 29.0 2.9 1 29.0 trg LHS1380 02 17 56.8 −35 37 01 21.6 5.9 11 24.5 3.8 12 28.6 2.8 1 28.6 trg LHS1386 02 18 41.4 −39 37 11 28.8 7.7 11 29.5 4.6 12 ... ... ... 29.5 ccd

– 102 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

SCR0228-6248 02 28 13.9 −62 48 05 29.6 9.4 11 26.2 4.2 12 ... ... ... 26.2 ccd SCR0232-3006 02 32 03.1 −30 06 41 31.3 9.2 11 29.3 4.6 12 ... ... ... 29.3 ccd SCR0234-8204 02 34 47.1 −82 04 29 36.8 16.3 7 50.1 7.7 12 ... ... ... 50.1 ccd LHS5058 02 36 32.8 −34 36 32 23.2 6.4 11 ... ... ... 31.4 3.2 1 31.4 trg SCR0238-1420 02 38 07.5 −14 20 11 23.3 7.1 11 26.4 4.4 12 ... ... ... 26.4 ccd L441-032 02 39 56.7 −38 28 00 20.4 6.0 11 ... ... ... 34.4 2.7 1 34.4 trg LHS0158 02 42 02.9 −44 30 59 58.6 16.9 8 62.7 10.1 12 40.1 2.6 1 40.1 trg LP651-009 02 46 12.9 −04 19 57 40.4 10.7 11 39.1 6.0 12 ... ... ... 39.1 ccd LP651-011 02 46 48.9 −04 21 28 38.8 10.5 11 42.1 6.5 12 ... ... ... 42.1 ccd SCR0247-5729 02 47 14.6 −57 29 22 [37.3] 10.3 11 [36.6] 5.9 12 ... ... ... [36.6] ccd LHS1459 02 51 43.3 −26 01 39 56.2 15.4 11 69.3 10.8 11 ... ... ... 69.3 ccd LTT01393 02 55 23.2 −25 13 29 16.3 4.9 11 ... ... ... 29.0 1.3 1 29.0 trg L012-040 03 03 26.4 −82 50 39 20.6 6.8 11 ... ... ... 36.7 1.7 1 36.7 trg LTT01453 03 03 36.7 −25 35 33 16.5 4.7 11 18.8 3.4 12 38.6 3.9 1 38.6 trg LTT01552 03 17 28.2 −01 07 27 37.2 10.6 11 45.6 7.2 12 ... ... ... 45.6 ccd LP887-068 03 17 35.1 −27 41 47 17.9 4.9 11 ... ... ... 29.5 2.3 1 29.5 trg G077-042 03 17 55.4 −01 05 41 45.5 12.1 11 52.1 8.3 12 ... ... ... 52.1 ccd LP888-006 03 20 51.1 −28 15 34 24.6 7.2 10 26.2 4.2 12 ... ... ... 26.2 ccd SCR0325-0308 03 25 03.1 −03 08 20 24.8 7.4 11 31.4 4.9 12 ... ... ... 31.4 ccd LHS1561 03 34 39.6 −04 50 33 17.4 4.9 11 13.5 2.1 12 29.2 3.5 1 29.2 trg SCR0337-1056 03 37 38.2 −10 56 55 21.3 5.9 6 26.2 4.1 9 ... ... ... 26.2 ccd GJ0155.3 03 53 19.7 −37 03 59 20.3 5.7 11 ... ... ... 25.1 1.8 2 25.1 trg LHS1622 04 03 30.4 −37 53 33 25.1 8.0 11 27.7 4.3 12 ... ... ... 27.7 ccd LHS0186 04 03 38.4 −05 08 05 {67.1} 20.0 11 {99.6} 16.1 11 51.6 12.0 1 51.6 trg WT0135 04 11 27.1 −44 18 10 {50.5} 14.0 11 {54.6} 9.3 12 25.6 1.6 1 25.6 trg LHS1656 04 18 51.0 −57 14 01 26.2 7.5 11 25.7 4.0 12 25.4 1.3 1 25.4 trg L446-008 04 21 00.5 −35 51 21 16.8 4.9 7 23.5 3.9 9 29.0 1.5 1 29.0 trg LHS1676 04 31 44.0 −21 50 44 28.1 9.3 11 26.8 5.2 12 ... ... ... 26.8 ccd LHS1678 04 32 42.6 −39 47 12 25.4 6.9 11 27.1 4.2 12 ... ... ... 27.1 ccd SCR0457-0731 04 57 23.8 −07 31 40 28.2 7.7 11 25.2 3.9 12 ... ... ... 25.2 ccd L305-024 05 06 07.3 −47 12 52 21.1 5.7 11 30.3 4.9 12 ... ... ... 30.3 ccd LP892-040 05 21 15.9 −32 21 27 24.4 6.8 11 25.3 4.1 12 ... ... ... 25.3 ccd SCR0525-7425 05 25 45.6 −74 25 26 28.7 9.4 11 42.2 6.6 12 ... ... ... 42.2 ccd SCR0527-7231 05 27 07.0 −72 31 20 22.7 6.5 11 25.1 3.9 12 ... ... ... 25.1 ccd LHS1815 06 04 20.4 −55 18 47 20.3 5.4 11 ... ... ... 28.2 1.9 2 28.2 trg SCR0610-1832 06 10 08.2 −18 32 25 31.8 9.4 11 31.2 4.8 12 ... ... ... 31.2 ccd LHS1837 06 19 50.7 −59 52 25 39.7 10.6 11 45.2 7.0 12 ... ... ... 45.2 ccd SCR0629-4648 06 29 33.6 −46 48 37 25.8 6.8 11 27.3 4.3 12 ... ... ... 27.3 ccd SCR0635-6722 06 35 48.8 −67 22 59 22.7 6.3 11 26.1 4.2 11 ... ... ... 26.1 ccd SCR0639-6939 06 39 08.4 −69 39 32 36.0 9.9 11 39.7 6.2 12 ... ... ... 39.7 ccd SCR0639-6934 06 39 22.3 −69 34 13 33.4 9.1 11 38.5 6.1 12 ... ... ... 38.5 ccd LP453-049 06 44 32.4 −38 31 59 23.6 6.8 11 26.1 4.2 12 ... ... ... 26.1 ccd SCR0659-2031 06 59 48.7 −20 31 47 29.2 8.9 11 31.3 4.8 12 ... ... ... 31.3 ccd LHS1904 07 11 19.7 −67 07 22 19.5 5.7 11 24.5 4.0 10 26.4 1.0 2 26.4 trg SCR0714-7140 07 14 26.2 −71 40 38 33.1 9.9 11 29.4 4.7 12 ... ... ... 29.4 ccd SCR0719-5050 07 19 35.4 −50 50 52 26.6 12.6 11 27.4 4.3 12 ... ... ... 27.4 ccd SCR0725-8530 07 25 22.2 −85 30 58 39.7 10.8 11 42.9 6.9 12 ... ... ... 42.9 ccd

– 103 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LTT02856 07 26 29.1 −70 49 41 22.2 6.0 11 25.2 4.0 12 ... ... ... 25.2 ccd WT0214 07 28 40.1 −61 20 41 44.2 13.8 11 50.3 9.4 12 ... ... ... 50.3 ccd GJ2061 07 31 04.1 −37 13 46 18.2 5.3 11 20.7 3.2 12 33.3 4.6 1 33.3 trg SCR0743-1929 07 43 22.1 −19 29 04 29.4 13.4 11 29.1 4.5 12 ... ... ... 29.1 ccd SCR0745-4814 07 45 32.2 −48 14 57 31.5 9.4 11 30.9 5.2 12 ... ... ... 30.9 ccd GJ1100 07 47 03.1 −13 56 19 22.5 6.3 11 26.8 4.6 11 27.6 1.9 2 27.6 trg SCR0749-4955 07 49 29.4 −49 55 06 26.4 7.8 11 30.4 5.0 12 ... ... ... 30.4 ccd SCR0758-4126 07 58 28.7 −41 26 44 27.6 9.0 11 30.0 4.6 12 ... ... ... 30.0 ccd LP784-012 08 02 03.4 −17 10 18 17.4 6.0 7 ... ... ... 30.0 1.1 1 30.0 trg SCR0810-4056 08 10 20.3 −40 56 50 28.9 7.8 11 34.0 5.4 12 ... ... ... 34.0 ccd SCR0829-6203 08 29 24.7 −62 03 23 37.9 11.6 11 47.2 8.7 12 ... ... ... 47.2 ccd L891-016 08 31 21.6 −06 02 02 17.4 4.9 11 18.0 3.3 12 26.4 1.9 1 26.4 trg L186-042 08 35 47.5 −56 45 13 23.6 6.3 7 36.3 5.7 9 ... ... ... 36.3 ccd LTT03187 08 36 14.3 −41 33 26 15.3 5.7 8 ... ... ... 39.0 3.1 2 39.0 trg GJ0316 08 40 00.3 −06 28 33 11.8 4.1 11 16.1 2.8 10 30.1 3.5 2 30.1 trg SCR0840-3113 08 40 56.6 −31 13 33 23.8 6.5 11 25.1 3.9 12 ... ... ... 25.1 ccd L098-062 08 41 32.6 −68 25 40 17.4 6.7 9 24.5 4.3 10 30.8 1.4 1 30.8 trg SCR0843-2937 08 43 09.5 −29 37 31 28.3 8.3 11 28.8 4.7 12 ... ... ... 28.8 ccd SCR0844-7120 08 44 54.6 −71 20 43 29.9 8.3 11 32.0 5.3 12 ... ... ... 32.0 ccd SCR0852-3507 08 52 54.1 −35 07 33 24.7 9.8 11 25.1 3.9 12 ... ... ... 25.1 ccd SCR0853-6123 08 53 03.0 −61 23 48 40.3 15.0 11 35.2 5.8 12 ... ... ... 35.2 ccd LHS2072 08 55 04.7 −71 35 48 25.2 7.1 11 25.3 4.0 12 ... ... ... 25.3 ccd LP786-022 08 57 14.2 −19 35 04 21.3 6.3 11 ... ... ... 28.3 2.1 1 28.3 trg SCR0859-7517 08 59 52.0 −75 17 30 27.1 7.6 11 31.4 4.9 12 ... ... ... 31.4 ccd SCR0904-4851 09 04 47.8 −48 51 24 29.7 12.9 11 35.0 5.5 12 ... ... ... 35.0 ccd SCR0912-8311 09 12 59.6 −83 11 52 30.4 8.8 11 28.6 4.5 12 ... ... ... 28.6 ccd SCR0914-7304 09 14 53.9 −73 04 19 26.3 7.5 11 29.8 4.6 12 ... ... ... 29.8 ccd SCR0916-3431 09 16 07.1 −34 31 31 28.5 8.6 11 29.8 4.6 12 ... ... ... 29.8 ccd SIP0933-1602 09 33 49.7 −16 02 55 34.8 14.6 11 32.3 7.2 12 ... ... ... 32.3 ccd SCR0936-3237 09 36 01.5 −32 37 59 25.2 7.0 11 27.9 4.4 12 ... ... ... 27.9 ccd CE089 09 38 53.8 −33 48 45 32.0 9.7 11 27.8 5.4 12 ... ... ... 27.8 ccd SCR0943-4833 09 43 18.2 −48 33 50 26.1 7.1 11 26.3 4.2 12 ... ... ... 26.3 ccd L462-023 09 44 45.4 −36 32 38 22.6 6.5 11 ... ... ... 39.8 3.5 1 39.8 trg SCR0947-0020 09 47 20.1 −00 20 09 29.3 9.8 11 26.3 4.5 12 ... ... ... 26.3 ccd LHS2209 09 54 52.5 −13 31 21 66.2 17.9 11 85.0 13.2 12 ... ... ... 85.0 ccd SCR1005-4322 10 05 03.1 −43 22 28 28.1 7.3 6 29.3 4.7 12 ... ... ... 29.3 ccd WT0248 10 05 54.9 −67 21 31 47.1 19.3 11 42.8 7.5 12 26.0 1.0 1 26.0 trg LTT03719 10 10 00.0 −25 58 33 19.4 6.0 11 ... ... ... 37.6 2.7 1 37.6 trg LHS2228 10 11 09.2 −82 51 58 19.2 5.7 11 ... ... ... 28.0 2.4 1 28.0 trg SCR1011-8106 10 11 12.4 −81 06 42 26.7 9.4 11 30.6 4.8 12 ... ... ... 30.6 ccd LTT03763 10 15 50.1 −11 47 48 21.9 7.1 11 ... ... ... 38.5 5.2 1 38.5 trg L752-053 10 21 08.1 −17 43 38 19.8 5.5 5 22.3 3.9 12 33.1 2.6 1 33.1 trg LHS2257 10 24 23.4 −02 34 18 57.1 26.7 5 47.2 49.2 11 ... ... ... 47.2 ccd LHS0284 10 36 03.1 −14 42 29 {67.9} 19.2 11 {66.8} 13.6 12 47.3 2.9 1 47.3 trg LP904-036 10 36 28.4 −28 27 15 14.4 4.1 11 17.7 3.0 12 25.2 2.0 1 25.2 trg LP904-045 10 40 18.5 −29 30 23 20.0 6.1 11 ... ... ... 37.7 3.3 1 37.7 trg L017-050 10 41 56.4 −82 59 23 19.7 6.5 11 27.1 4.3 12 ... ... ... 27.1 ccd

– 104 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP905-022 10 51 58.9 −32 01 20 16.7 5.1 11 ... ... ... 32.4 2.8 1 32.4 trg LP849-020 10 52 26.4 −22 41 16 23.9 6.6 11 ... ... ... 28.6 2.2 1 28.6 trg LTT04033 10 58 41.3 −42 40 09 23.3 9.8 9 ... ... ... 51.9 9.5 2 51.9 trg LTT04042 11 00 02.8 −35 06 37 16.9 4.6 11 ... ... ... 33.8 5.1 1 33.8 trg SCR1104-0150 11 04 08.4 −01 50 18 29.6 9.7 11 38.2 6.1 12 ... ... ... 38.2 ccd SCR1104-8352 11 04 51.0 −83 52 25 33.1 14.3 11 53.9 9.0 12 ... ... ... 53.9 ccd UPM1105-5825 11 05 30.4 −58 25 19 40.6 17.1 7 41.4 6.4 12 ... ... ... 41.4 ccd LTT04105 11 09 12.2 −04 36 25 18.1 5.2 11 ... ... ... 28.5 3.7 1 28.5 trg LHS0299 11 11 22.7 −06 31 56 {109.1} 29.9 9 {142.2} 22.8 9 83.3 21.4 1 83.3 trg LP792-044 11 13 13.0 −19 06 23 54.7 14.8 11 60.7 13.4 12 ... ... ... 60.7 ccd SCR1117-3202 11 17 29.3 −32 02 10 26.3 8.1 11 27.6 4.3 12 ... ... ... 27.6 ccd SCR1118-3511 11 18 59.7 −35 11 39 28.0 8.9 11 26.8 4.2 12 ... ... ... 26.8 ccd SCR1121-8057 11 21 27.9 −80 57 03 32.4 10.2 11 32.0 5.0 12 ... ... ... 32.0 ccd GJ0429.2 11 28 00.5 −09 10 57 30.8 8.6 7 36.8 5.7 11 25.1 1.9 2 25.1 trg SCR1132-8446 11 32 22.3 −84 46 28 62.7 23.4 11 87.3 18.0 12 ... ... ... 87.3 ccd USN1137-0317 11 37 16.6 −03 17 37 34.4 9.8 11 27.4 5.1 12 ... ... ... 27.4 ccd CE440-087 11 47 50.7 −28 49 45 84.0 36.7 5 67.7 13.9 12 ... ... ... 67.7 ccd Ruiz440-064 11 48 50.6 −28 33 23 28.1 7.6 3 25.3 4.4 12 39.8 2.4 1 39.8 trg SCR1153-5430 11 53 22.6 −54 30 08 27.5 8.1 11 27.3 10.8 12 ... ... ... 27.3 ccd SCR1159-4256 11 59 37.7 −42 56 39 26.7 7.0 11 26.5 4.2 12 ... ... ... 26.5 ccd LP907-063 12 03 03.9 −33 39 55 45.8 13.5 11 36.9 6.8 12 ... ... ... 36.9 ccd SCR1204-4037 12 04 15.5 −40 37 53 21.2 5.7 11 25.1 3.9 12 ... ... ... 25.1 ccd GJ2090 12 04 36.6 −38 16 25 18.6 5.5 11 ... ... ... 27.5 3.1 1 27.5 trg WT1928 12 08 06.9 −32 06 36 23.8 10.0 11 35.9 5.8 12 ... ... ... 35.9 ccd NLTT30217 12 17 06.8 −17 38 15 23.8 7.0 11 28.5 4.6 12 ... ... ... 28.5 ccd LHS0323 12 17 30.2 −29 02 21 {73.3} 22.1 11 {76.7} 15.3 12 42.9 3.4 1 42.9 trg LP470-065 12 17 46.8 −39 04 05 [22.8] 6.7 11 ... ... ... 30.9 2.5 1 30.9 trg SCR1217-3557 12 17 55.8 −35 57 15 24.4 6.7 11 26.8 4.2 12 ... ... ... 26.8 ccd SCR1220-8302 12 20 03.7 −83 02 29 25.0 8.8 11 26.4 4.1 12 ... ... ... 26.4 ccd LHS0326 12 24 26.8 −04 43 37 {99.9} 31.4 11 {140.7} 23.4 9 49.0 4.7 1 49.0 trg SCR1224-8205 12 24 39.8 −82 05 53 25.4 7.7 11 25.7 4.0 12 ... ... ... 25.7 ccd SCR1227-4039 12 27 03.9 −40 39 40 24.4 6.7 11 30.1 5.0 12 ... ... ... 30.1 ccd LP909-006 12 30 19.6 −28 24 31 31.3 12.8 11 28.1 4.3 12 ... ... ... 28.1 ccd LHS2573 12 32 32.2 −26 10 14 31.4 8.5 11 33.2 5.6 12 ... ... ... 33.2 ccd LTT04828 12 39 55.9 −08 34 42 22.9 6.8 11 ... ... ... 36.0 3.8 1 36.0 trg WT1962 12 59 51.3 −07 30 35 [47.5] 12.9 11 [44.6] 7.1 12 ... ... ... [44.6] ccd L147-045 13 04 43.8 −62 15 26 14.7 6.3 11 ... ... ... 38.5 5.0 1 38.5 trg LHS2698 13 13 29.6 −32 27 05 36.8 9.9 11 44.4 7.3 12 46.3 2.0 1 46.3 trg LP910-061 13 16 21.9 −33 47 45 24.6 7.0 11 ... ... ... 39.1 4.4 1 39.1 trg SCR1322-7254 13 22 27.5 −72 54 37 44.1 11.8 11 41.9 6.5 12 ... ... ... 41.9 ccd SCR1328-7253 13 28 42.1 −72 53 47 71.2 20.3 11 71.7 13.0 12 ... ... ... 71.7 ccd LHS2744 13 30 52.6 −32 37 49 24.6 7.1 11 ... ... ... 38.2 3.3 1 38.2 trg SIP1338-3752 13 38 26.5 −37 52 50 41.3 12.7 11 37.7 9.0 12 ... ... ... 37.7 ccd LTT05294 13 39 37.6 −01 35 43 22.8 7.6 9 ... ... ... 32.3 3.5 1 32.3 trg SIP1343-3823 13 43 49.4 −38 23 50 33.7 9.7 11 35.5 5.5 12 ... ... ... 35.5 ccd LTT05330 13 44 55.1 −45 35 19 17.8 8.2 6 28.7 4.6 9 ... ... ... 28.7 ccd SCR1347-7610 13 47 56.8 −76 10 20 22.6 6.2 11 29.2 4.7 9 ... ... ... 29.2 ccd

– 105 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP912-026 13 53 19.8 −30 46 38 21.1 6.2 11 ... ... ... 33.3 4.2 1 33.3 trg LHS2841 14 00 57.0 −31 47 50 16.3 5.3 11 ... ... ... 33.7 2.7 2 33.7 trg GJ0539.2 14 09 27.2 −30 55 49 19.9 5.6 11 27.5 4.7 12 39.4 5.2 2 39.4 trg SCR1410-2750 14 10 22.6 −27 50 59 24.8 7.8 11 30.0 4.9 12 ... ... ... 30.0 ccd L836-121 14 14 21.4 −15 21 22 [12.8] 3.6 8 [16.2] 3.5 11 30.2 1.4 1 30.2 trg LHS5275 14 39 58.8 −56 54 46 19.3 5.2 6 ... ... ... 56.5 2.6 1 56.5 trg SCR1450-3742 14 50 02.9 −37 42 10 30.1 9.1 11 25.9 4.2 12 ... ... ... 25.9 ccd LHS0381 14 50 28.9 −08 38 37 {87.0} 27.3 11 {129.8} 21.3 10 36.5 7.5 1 36.5 trg LHS0382 14 50 41.2 −16 56 31 {84.8} 24.8 11 {79.8} 14.7 12 48.3 5.3 1 48.3 trg LHS0385 14 55 35.8 −15 33 44 {105.7} 29.2 11 {140.0} 24.1 9 49.0 15.2 1 49.0 trg SCR1510-5141 15 10 56.6 −51 41 36 28.1 8.5 11 27.5 4.4 12 ... ... ... 27.5 ccd UPM1515-6258 15 15 04.9 −62 58 06 35.7 26.0 10 59.7 9.2 12 ... ... ... 59.7 ccd LP915-016 15 17 21.1 −27 59 50 [18.8] 6.3 10 [25.2] 4.4 10 29.4 3.3 1 29.4 trg UPM1523-5454 15 23 43.7 −54 54 35 ... ... 0 29.7 4.8 12 ... ... ... 29.7 ccd LP802-068 15 24 45.8 −17 07 39 16.8 5.0 11 ... ... ... 34.6 6.4 1 34.6 trg SCR1528-3807 15 28 50.6 −38 07 41 21.3 7.9 11 35.0 5.9 12 ... ... ... 35.0 ccd LEHPM2-0016 15 29 14.0 −29 07 38 51.8 16.3 11 47.4 11.4 12 36.0 1.3 1 36.0 trg SCR1532-3622 15 32 13.9 −36 22 31 23.0 10.3 11 31.6 5.0 12 ... ... ... 31.6 ccd LP916-023 15 44 05.5 −32 05 22 22.3 6.7 11 26.1 4.0 12 ... ... ... 26.1 ccd L336-071 15 49 38.3 −47 36 34 20.5 5.9 11 25.9 4.2 10 27.2 1.6 2 27.2 trg LP916-003 15 54 23.5 −33 08 44 16.7 6.4 11 27.0 4.7 12 ... ... ... 27.0 ccd LP684-003 15 56 41.4 −04 14 21 23.2 6.9 11 ... ... ... 40.8 6.2 1 40.8 trg LHS3144 16 00 27.8 −34 43 17 21.3 7.1 11 30.0 4.9 12 ... ... ... 30.0 ccd LHS3147 16 02 23.6 −25 05 57 23.1 7.3 11 20.7 3.2 12 25.5 0.9 1 25.5 trg SCR1608-4442 16 08 43.9 −44 42 29 27.5 13.2 11 31.8 5.2 12 ... ... ... 31.8 ccd SCR1609-3730 16 09 05.4 −37 30 40 29.2 13.0 11 50.8 8.0 10 ... ... ... 50.8 ccd LEP1610-0040 16 10 29.0 −00 40 54 [37.5] 13.3 11 [35.3] 6.5 12 ... ... ... [35.3] ccd GJ0618.1 16 20 24.8 −04 16 02 16.4 4.5 9 22.1 3.9 10 33.5 2.4 2 33.5 trg LP745-070 16 33 41.6 −09 33 12 18.6 6.5 10 ... ... ... 30.7 2.3 1 30.7 trg SCR1637-4703 16 37 56.6 −47 03 44 28.4 9.3 11 31.9 5.0 12 ... ... ... 31.9 ccd 2MA1651-2719 16 51 59.8 −27 19 51 ... ... 0 32.2 5.1 12 ... ... ... 32.2 ccd CCD1702-2718 17 02 09.1 −27 18 24 19.3 6.3 11 30.2 6.7 11 ... ... ... 30.2 ccd LP806-025 17 07 58.3 −19 28 43 10.8 9.1 11 27.3 4.2 12 ... ... ... 27.3 ccd NLTT44264 17 10 03.8 −21 46 56 11.7 9.5 11 32.3 5.1 12 ... ... ... 32.3 ccd SCR1712-1907 17 12 26.1 −19 07 04 22.1 20.7 11 44.7 7.0 12 ... ... ... 44.7 ccd SCR1716-2239 17 16 35.7 −22 39 49 24.4 18.1 11 35.2 5.4 12 ... ... ... 35.2 ccd UPM1718-2245 17 18 25.6 −22 46 29 18.2 15.6 11 32.8 6.7 12 ... ... ... 32.8 ccd LHS0440 17 18 32.3 −43 26 38 38.7 10.7 7 41.1 6.4 12 27.5 2.1 1 27.5 trg LP920-011 17 19 13.7 −27 45 44 12.9 7.8 9 32.5 5.1 12 ... ... ... 32.5 ccd GJ1217 17 22 43.0 −14 57 37 19.0 6.3 10 27.7 4.6 9 26.9 1.8 1 26.9 trg LP687-026 17 22 50.6 −03 29 38 23.5 14.1 10 38.8 6.2 12 ... ... ... 38.8 ccd SCR1724-3727 17 24 07.0 −37 27 53 23.4 10.1 11 30.2 4.7 12 ... ... ... 30.2 ccd SCR1733-2452 17 33 04.6 −24 52 57 22.6 14.2 8 52.8 8.6 12 ... ... ... 52.8 ccd SCR1735-4051 17 35 15.5 −40 51 13 27.2 12.6 11 28.6 4.4 12 ... ... ... 28.6 ccd LTT07022 17 39 28.3 −22 41 46 14.3 9.1 9 ... ... ... 43.5 20.7 1 43.5 trg SCR1750-2530 17 50 07.6 −25 30 21 19.1 6.9 11 25.6 4.8 12 ... ... ... 25.6 ccd SCR1750-0128 17 50 14.4 −01 28 51 29.3 13.3 11 33.0 5.5 12 ... ... ... 33.0 ccd

– 106 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LHS0456 17 50 59.0 −56 36 07 25.6 8.0 11 31.9 5.0 12 ... ... ... 31.9 ccd LP808-023 17 51 27.5 −18 59 32 14.6 8.1 9 ... ... ... 44.0 5.8 1 44.0 trg SCR1753-7403 17 53 32.6 −74 03 46 26.1 7.4 11 26.1 4.2 12 ... ... ... 26.1 ccd SCR1755-0455 17 55 30.7 −04 55 42 21.5 18.5 11 26.5 4.1 12 ... ... ... 26.5 ccd SCR1800-0755 18 00 33.9 −07 55 03 21.1 13.1 11 36.3 6.7 12 ... ... ... 36.3 ccd SCR1801-7000 18 01 28.9 −70 00 49 26.2 7.1 11 27.8 4.3 12 ... ... ... 27.8 ccd SCR1802-1919 18 02 28.7 −19 19 19 23.1 20.0 10 48.8 7.8 12 ... ... ... 48.8 ccd L077-206 18 06 55.6 −74 35 20 33.7 11.8 11 36.0 5.7 12 ... ... ... 36.0 ccd LEHPM2-0088 18 08 00.0 −81 20 49 28.3 8.6 7 34.4 5.4 12 ... ... ... 34.4 ccd SCR1808-0341 18 08 48.4 −03 41 54 49.4 41.0 9 87.4 14.2 12 ... ... ... 87.4 ccd LTT07218 18 09 33.3 −12 02 20 13.3 5.5 11 ... ... ... 28.4 1.0 2 28.4 trg LEP1809-0247 18 09 50.1 −02 47 43 28.3 24.6 8 35.6 7.6 12 ... ... ... 35.6 ccd SCR1820-6225 18 20 49.4 −62 25 53 28.3 7.9 11 36.4 5.8 10 ... ... ... 36.4 ccd GJ1226 18 20 57.2 −01 02 58 [15.5] 5.3 11 [12.7] 3.9 12 25.8^a 2.0 2 25.8 trg SCR1821-0700 18 21 54.2 −07 00 18 18.6 12.5 9 38.9 6.7 12 ... ... ... 38.9 ccd G155-020 18 31 04.4 −09 58 09 21.2 13.6 11 26.8 4.2 12 ... ... ... 26.8 ccd SCR1842-2736 18 42 56.7 −27 36 33 38.5 13.4 7 50.3 8.6 12 ... ... ... 50.3 ccd SCR1844-1310 18 44 59.6 −13 10 24 23.2 17.7 10 44.2 6.8 12 ... ... ... 44.2 ccd G155-041 18 47 36.0 −17 03 16 23.7 12.5 11 38.4 5.9 12 ... ... ... 38.4 ccd LHS0468 18 48 44.9 −02 33 46 {28.4} 15.5 11 {49.1} 7.9 12 28.6 2.3 1 28.6 trg SCR1851-6156 18 51 55.4 −61 56 56 25.5 6.9 11 27.4 4.3 12 ... ... ... 27.4 ccd LHS3421 18 52 52.4 −57 07 37 14.4 4.5 11 ... ... ... 26.6 2.7 2 26.6 trg SCR1853-7537 18 53 26.6 −75 37 40 20.1 6.1 11 25.9 4.4 10 ... ... ... 25.9 ccd SCR1854-2859 18 54 20.8 −28 59 53 18.8 15.0 10 41.7 6.5 12 ... ... ... 41.7 ccd SCR1900-2547 19 00 47.1 −25 47 13 25.8 8.0 11 28.8 4.5 12 ... ... ... 28.8 ccd SCR1907-7924 19 07 53.5 −79 24 03 29.0 8.9 11 33.8 5.3 12 ... ... ... 33.8 ccd SCR1916-3638 19 16 46.6 −36 38 06 {199.2} 60.9 11 {280.7} 47.9 11 67.7 6.3 1 67.7 trg LP347-017 19 19 09.0 −45 47 59 20.9 6.4 11 ... ... ... 38.7 5.4 1 38.7 trg LHS3451 19 19 29.3 −18 19 06 68.0 18.7 11 59.7 9.8 12 ... ... ... 59.7 ccd LEHPM2-3658 19 22 43.7 −43 19 21 25.2 6.8 11 26.6 4.3 12 ... ... ... 26.6 ccd L347-073 19 26 30.2 −48 36 16 24.8 7.1 11 26.6 4.5 12 ... ... ... 26.6 ccd L347-072 19 27 30.9 −48 33 53 27.9 7.6 11 31.8 4.9 12 ... ... ... 31.8 ccd L208-005 19 30 13.7 −54 56 19 23.8 7.6 9 ... ... ... 34.6 3.3 1 34.6 trg SCR1932-0652 19 32 46.3 −06 52 18 23.7 9.1 11 26.7 4.1 12 ... ... ... 26.7 ccd GJ0762 19 34 36.5 −62 50 39 15.9 5.3 11 20.4 3.1 12 25.7 0.9 2 25.7 trg SCR1936-4816 19 36 33.3 −48 16 54 26.3 7.6 11 25.9 4.2 12 ... ... ... 25.9 ccd LTT07786 19 42 52.8 −45 04 53 12.5 3.4 8 ... ... ... 27.3 1.0 2 27.3 trg LHS3480 19 44 22.0 −22 30 54 {91.1} 29.2 11 {106.2} 20.3 12 56.5 37.3 1 56.5 trg LHS3492 19 51 31.3 −50 55 38 34.0 9.8 11 38.8 6.8 12 ... ... ... 38.8 ccd GJ0769 19 54 00.1 −47 48 37 21.7 8.8 11 27.3 4.3 12 25.3 5.7 1 25.3 trg SCR1954-7356 19 54 06.4 −73 56 51 64.3 17.8 11 73.5 13.0 12 ... ... ... 73.5 ccd SCR1955-2856 19 55 16.8 −28 56 43 26.2 7.8 11 27.5 4.5 12 ... ... ... 27.5 ccd SCR1959-5549 19 59 58.8 −55 49 30 25.0 7.0 11 27.1 4.3 12 ... ... ... 27.1 ccd L277-205 20 03 52.4 −53 57 28 22.3 6.0 11 27.2 4.3 12 ... ... ... 27.2 ccd L277-082 20 10 45.4 −51 19 39 37.7 10.9 11 49.2 7.8 9 ... ... ... 49.2 ccd LHS3528 20 10 55.5 −25 35 09 {22.0} 8.3 11 {58.4} 22.1 8 ... ... ... {58.4} ccd LP814-044 20 17 52.4 −17 17 09 18.3 6.6 6 ... ... ... 35.1 2.8 1 35.1 trg

– 107 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

LP815-001 20 20 07.1 −19 39 03 20.2 7.7 8 28.0 4.3 12 ... ... ... 28.0 ccd WT0708 20 27 04.4 −68 41 07 33.9 9.8 11 31.9 5.1 12 ... ... ... 31.9 ccd LTT08147 20 36 43.6 −02 41 20 24.9 8.7 10 27.7 4.7 12 ... ... ... 27.7 ccd SCR2042-5737 20 42 46.4 −57 37 15 [22.7] 8.5 11 [25.3] 5.9 12 ... ... ... [25.3] ccd SCR2043-6501 20 43 10.4 −65 01 17 55.3 15.6 11 67.1 11.9 12 ... ... ... 67.1 ccd LHS3582 20 46 18.0 −47 09 28 24.0 6.5 8 ... ... ... 32.5 11.4 1 32.5 trg 2MA2051-2458 20 51 09.8 −24 58 18 24.2 7.0 11 25.4 4.0 12 ... ... ... 25.4 ccd LHS3600 20 55 59.9 −59 56 44 12.9 5.3 11 ... ... ... 27.8 1.1 1 27.8 trg LEHPM1-4008 20 58 30.4 −65 01 11 33.1 12.7 11 36.6 5.8 12 ... ... ... 36.6 ccd LP816-061 20 59 06.6 −16 05 37 23.2 6.5 11 ... ... ... 33.8 2.9 1 33.8 trg L211-096 20 59 51.3 −58 45 31 14.8 6.3 11 ... ... ... 30.2 2.9 1 30.2 trg SCR2102-3128 21 02 15.6 −31 28 13 26.2 7.2 11 28.0 4.3 12 ... ... ... 28.0 ccd LHS3620 21 04 25.4 −27 52 47 {188.7} 54.4 11 {246.0} 41.8 11 77.6 8.5 1 77.6 trg LEHPM1-4021 21 05 11.4 −62 47 02 43.7 16.1 11 47.8 9.4 12 ... ... ... 47.8 ccd SCR2105-3515 21 05 41.8 −35 15 00 27.5 7.7 11 28.2 4.4 12 ... ... ... 28.2 ccd LHS0505 21 11 57.9 −31 03 16 37.9 9.9 3 42.3 7.7 12 ... ... ... 42.3 ccd LEHPM1-4051 21 15 15.1 −75 41 52 26.1 7.6 11 24.6 3.8 12 30.3 4.6 1 30.3 trg LP637-024 21 19 18.3 −00 33 19 24.1 6.6 9 ... ... ... 40.4 6.1 1 40.4 trg GJ0836.4 21 42 07.5 −12 09 48 20.3 5.6 11 16.9 3.0 12 35.0 3.2 1 35.0 trg L048-001 21 42 58.5 −74 05 56 21.9 6.3 11 26.7 4.5 12 ... ... ... 26.7 ccd CD-32 16735 21 47 02.7 −32 24 40 2.5 0.9 11 2.3 0.6 12 213.2 558.9 1 213.2 trg L282-061 21 51 12.3 −52 15 40 23.1 6.3 9 32.1 5.1 9 31.7 2.5 1 31.7 trg LHS0515 21 55 48.0 −11 21 43 {151.3} 50.6 11 {207.4} 48.9 12 51.3 11.0 1 51.3 trg LHS3740 21 58 53.2 −57 56 04 22.2 6.3 11 22.4 3.4 12 27.8 3.2 1 27.8 trg LHS3754 22 04 40.9 −19 46 42 43.1 17.1 4 49.3 8.7 12 ... ... ... 49.3 ccd LHS3775 22 12 56.0 −18 15 21 67.6 18.1 11 86.1 13.5 12 ... ... ... 86.1 ccd LP699-075 22 18 13.2 −03 10 20 19.2 5.4 8 ... ... ... 40.7 3.3 1 40.7 trg LEHPM1-4592 22 21 11.4 −19 58 15 {95.4} 27.9 11 {89.0} 29.1 12 ... ... ... {89.0} ccd WT0918 22 21 37.0 −65 47 30 41.0 12.7 11 38.0 6.2 12 ... ... ... 38.0 ccd LP931-054 22 23 18.0 −27 09 15 21.4 6.1 11 27.1 4.2 12 ... ... ... 27.1 ccd SCR2224-7242 22 24 51.6 −72 42 00 26.9 7.7 11 26.5 4.1 12 ... ... ... 26.5 ccd LEHPM1-4828 22 32 42.7 −60 16 34 35.4 12.3 11 42.5 6.8 12 ... ... ... 42.5 ccd LHS3836 22 38 02.9 −65 50 09 31.8 8.8 11 29.5 5.0 12 27.5 0.9 1 27.5 trg LP932-053 22 39 44.0 −32 04 18 20.7 6.5 9 ... ... ... 39.7 3.4 1 39.7 trg SCR2241-6119 22 41 44.4 −61 19 31 23.2 7.3 11 26.6 4.1 12 ... ... ... 26.6 ccd SCR2242-5103 22 42 10.9 −51 03 28 [29.2] 8.3 10 [34.7] 6.0 11 ... ... ... [34.7] ccd LHS3846 22 44 00.2 −04 57 57 65.5 22.0 9 66.1 11.1 12 ... ... ... 66.1 ccd L106-104 22 46 45.2 −63 18 05 18.3 5.2 11 22.0 3.4 12 25.1 1.9 1 25.1 trg LTT09210 22 48 53.0 −28 50 03 17.1 5.0 10 22.2 3.9 10 40.1 3.6 1 40.1 trg LTT09203 22 48 54.5 −54 18 52 17.5 6.1 11 26.0 4.5 10 33.6 3.0 1 33.6 trg L214-072 22 49 26.0 −58 15 12 19.6 5.6 11 ... ... ... 36.6 3.1 1 36.6 trg SCR2250-5726 22 50 45.0 −57 26 02 73.7 21.2 11 46.4 8.0 12 ... ... ... 46.4 ccd LP933-024 22 55 43.9 −30 22 39 [21.0] 6.1 11 ... ... ... 32.3 2.9 1 32.3 trg LHS5396 23 00 23.6 −31 07 12 17.4 5.1 11 21.4 3.6 12 30.8 2.4 1 30.8 trg L286-071 23 00 26.1 −53 13 40 20.9 6.6 10 ... ... ... 41.4 3.2 1 41.4 trg SCR2312-3124 23 12 08.7 −31 24 04 29.4 8.4 11 31.6 4.9 12 ... ... ... 31.6 ccd LHS5397 23 14 15.4 −56 50 52 19.6 5.6 11 ... ... ... 28.0 1.8 1 28.0 trg

– 108 –

Table 2—Continued

Name RA DEC d_{plt} σ_{tot} # rel d_{ccd} σ_{tot} # rel d_{trig} σ_{trig} # π d_{best} d type (pc) (pc) (pc) (pc) (pc) (pc) (pc) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

L168-009 23 20 07.5 −60 03 55 16.4 4.7 11 18.7 3.1 12 26.4 1.6 1 26.4 trg LTT09507 23 21 11.3 −01 35 45 20.9 5.7 11 ... ... ... 27.9 1.2 2 27.9 trg GJ0895.1 23 25 42.0 −45 36 35 19.3 5.6 11 21.7 3.6 12 35.9 3.6 2 35.9 trg SCR2325-8057 23 25 52.9 −80 57 41 43.1 15.1 11 30.2 4.7 12 ... ... ... 30.2 ccd L288-049 23 41 43.6 −51 56 37 21.5 5.9 11 ... ... ... 27.6 2.0 1 27.6 trg LEHPM1-6094 23 42 02.3 −78 41 23 40.7 12.4 11 40.4 7.1 12 ... ... ... 40.4 ccd WT1026 23 46 35.2 −52 47 02 72.8 19.3 11 88.7 14.4 12 ... ... ... 88.7 ccd LP1035-064 23 47 56.5 −39 11 13 22.7 6.4 11 25.3 4.0 12 ... ... ... 25.3 ccd LHS4025 23 50 52.6 −39 05 17 22.4 6.3 11 25.2 4.0 12 ... ... ... 25.2 ccd SCR2352-6124 23 52 29.5 −61 24 23 50.3 14.6 11 59.4 11.2 12 ... ... ... 59.4 ccd L361-021 23 57 45.6 −45 48 55 20.2 5.6 11 27.1 4.5 10 41.0 5.0 2 41.0 trg

aThe weighted mean distance includes that of both the primary and the secondary components.

Table 3. Comparison Photometry for Giants

Name RA DEC V_J R_{KC} I_{KC} # nts J H K_s (mag) (mag) (mag) (mag) (mag) (mag)

TT SCL 00 16 54.6 −30 13 52 11.81 10.89 10.18 2 8.92 8.21 7.98 AF ERI 04 20 19.5 −10 24 26 13.18 10.99 8.75 2 5.80 4.94 4.45 HD270965 05 00 40.4 −71 57 53 11.38 10.62 9.94 2 8.91 8.17 7.98 DEN0515-2200 05 15 36.6 −22 00 10 13.37 12.27 10.81 2 9.32 8.42 8.13 HD269328 05 17 07.5 −70 56 38 10.41 9.70 9.04 1 8.05 7.33 7.20 SCR0629-2101 06 29 20.2 −21 01 30 15.37 12.98 10.84 1 7.82 6.91 6.47 SCR0656-2918 06 56 15.9 −29 18 03 13.89 11.72 9.45 1 6.37 5.51 5.05 SCR0703-3507 07 03 49.6 −35 07 44 15.34 12.80 10.61 1 7.35 6.37 5.95 SCR0705-3534 07 05 47.4 −35 34 26 13.95 11.70 9.39 1 6.03 5.12 4.62 SCR0833-6107 08 33 27.7 −61 07 58 13.02 11.90 10.72 1 9.63 8.87 8.52 SCR1048-7739 10 48 26.7 −77 39 19 11.47 10.53 9.64 1 8.26 7.54 7.30 SCR1317-4643 13 17 56.5 −46 43 54 13.96 12.12 10.02 1 7.57 6.75 6.38 SCR1358-4910 13 58 43.6 −49 10 52 16.14 13.91 11.62 1 8.61 7.67 7.24 SCR1440-7837 14 40 37.4 −78 37 11 10.75 9.88 9.01 1 7.71 6.92 6.76 SCR1534-7237 15 34 02.5 −72 37 11 16.03 13.94 11.71 1 8.90 7.96 7.55 SCR1544-1805 15 44 45.0 −18 05 07 13.54 11.36 9.09 1 5.96 5.05 4.54 HIP082725 16 54 32.5 −62 24 14 11.55 10.82 10.12 1 9.06 8.32 8.15 SCR2000-0837 20 00 58.3 −08 37 28 14.49 12.08 9.73 1 6.46 5.46 5.04 V506AQL 20 02 50.8 −04 32 56 13.18 10.99 8.74 1 6.14 5.18 4.74 SCR2038-0409 20 38 45.5 −04 09 27 16.44 14.01 11.65 2 8.27 7.30 6.89 2MA2108-2120 21 08 33.1 −21 20 52 14.15 12.12 9.90 2 7.31 6.49 6.09 CD-32 16735 21 47 02.7 −32 24 40 9.22 8.11 6.70 3 5.24 4.41 4.06 LEHPM2-0438 23 50 08.3 −86 51 02 11.63 10.49 9.17 2 7.69 6.77 6.54

– 109 –

Table 4. Subdwarf Candidates

Name RA DEC μ PA d_{best} type V_{tan} Spec Typ ref (^{′′}yr^{−1}) (deg) (pc) (kms^{−1})

LHS0109 00 17 40.0 −10 46 17 1.051 180.0 35.21 trg 175 M1.0VI 4 LHS0110 00 19 37.0 −28 09 46 1.388 192.2 30.45 trg 195 M4.0JVI: 5 GJ1062 03 38 15.7 −11 29 14 2.958 152.0 16.03 trg 230 M2.5VI 1 LHS0186 04 03 38.4 −05 08 05 1.153 168.0 51.55 trg 282 M2.0VI 4 WT0135 04 11 27.1 −44 18 10 0.692 067.1 25.61 trg 84 M3.0VI 5 LHS0189 04 25 38.4 −06 52 37 1.237 145.1 18.44 trg 108 M3.0VIJ 4 GJ0191 05 11 40.6 −45 01 06 8.728 131.4 3.91 trg 162 M1.0VI 1 LHS0272 09 43 46.2 −17 47 06 1.439 279.2 13.52 trg 92 M3.0VI 1 LHS0284 10 36 03.1 −14 42 29 1.165 300.5 47.30 trg 261 M4.0V 5 LHS0299 11 11 22.7 −06 31 56 1.073 206.9 83.33 trg 424 M0.5VI 4 LHS0323 12 17 30.2 −29 02 21 1.147 308.1 42.94 trg 225 M4.0V 5 LHS0326 12 24 26.8 −04 43 37 1.301 241.8 49.04 trg 303 M3.0VI 4 LHS2852 14 02 46.7 −24 31 50 0.506 315.6 21.79 ccd 52 M2.0VI 1 LHS0375 14 31 38.3 −25 25 33 1.386 268.6 23.98 trg 158 M4.0VI 1 SSS1444-2019 14 44 20.3 −20 19 26 3.507 236.0 16.23 trg 270 M9.0VI: 7 LHS0381 14 50 28.9 −08 38 37 1.560 188.4 36.50 trg 270 M3.5VI 8 LHS0382 14 50 41.2 −16 56 31 1.379 243.6 48.33 trg 327 M3.5VI 3 LHS0385 14 55 35.8 −15 33 44 1.736 209.6 49.02 trg 403 M1.0VI 4 SCR1916-3638 19 16 46.6 −36 38 06 1.328 184.0 67.66 trg 426 M3.0VI 4 LHS3480 19 44 22.0 −22 30 54 0.547 139.5 56.50 trg 147 M4.0VI 1 LHS3528 20 10 55.5 −25 35 09 0.848 166.6 58.40 ccd 235 M4.5V 2 LHS3620 21 04 25.4 −27 52 47 0.985 184.4 77.64 trg 363 M2.0VI 5 LHS0515 21 55 48.0 −11 21 43 1.093 120.3 51.28 trg 265 M3.5VI 6 LEHPM1-4592 22 21 11.4 −19 58 15 1.066 125.1 88.99 ccd 450

Note. — Spectral Type References: (1) Gizis (1997); (2) Hawley et al. (1996); (3) Jao et al. (2005); (4) Jao et al. (2008); (5) Jao et al. (2011); (6) Reid & Gizis (2005); (7) Schilbach et al. (2009); (8) van Altena et al. (1995).

Table 5. Distance Statistics for Southern Red Dwarf Systems

Distance # Systems # Multiples # Subdwarfs

d ≤ 10.0 pc 104 24 [22] 1

10.0 < d ≤ 25.0 pc 1300 140 [96] 8

25.0 < d ≤ 100.0 pc 343 33 [15] 18

TOTAL 1747^a 197 27^b

Note. — Numbers in brackets indicate systems with unresolved photometry, some of which were used to calculate distance estimates that are likely underestimates.

aCD-32 16735 is beyond 100 pc and is not included in this total.

bTwo of the subdwarf systems are binaries, and thus are also included in the “Multiples” counts column.