arXiv:1407.0267v1 [astro-ph.SR] 1 Jul 2014

Astronomy & Astrophysics manuscript no. sodor © ESO 2018 June 6, 2018

MOST light-curve analysis of the γ Dor pulsator HR 8799, showing resonances and amplitude variations^⋆

Á. Sódor^{1, 2}, A.-N. Chené^3, P. De Cat^1, Zs. Bognár^{2 ⋆⋆}, D. J. Wright^{1, 4}, C. Marois^5, G. A. H. Walker^6, J. M. Matthews^7, T. Kallinger^8, J. F. Rowe^9, R. Kuschnig^8, D. B. Guenther^{10}, A. F. J. Moffat^{11}, S. M. Rucinski^{12}, D. Sasselov^{13}, and W. W. Weiss^8

1 Royal Observatory of Belgium, Ringlaan 3, B-1180 Brussel, Belgium; e-mail: adam.sodor@oma.be 2 Konkoly Observatory, MTA CSFK, Konkoly Thege M. u. 15–17, H–1121 Budapest, Hungary; e-mail: sodor@konkoly.hu 3 Gemini Observatory, Northern Operations Center, 670 North A’ohoku Place, Hilo, HI, 96720, USA 4 Department of Astrophysics and Optics, School of Physics, University of New South Wales, Sydney 2052, Australia 5 National Research Council Canada, Herzberg Institute of Astrophysics, 5071 West Saanich Road, Victoria, BC V9E 2E7, Canada 6 1234 Hewlett Place, Victoria, BC V8S 4P7, Canada 7 Department of Physics and Astronomy, University of British Columbia, 6224 Agricultural Road, Vancouver, BC V6T 1Z1, Canada 8 Institute for Astronomy (IfA), University of Vienna, Türkenschanzstrasse 17, 1180 Vienna, Austria 9 NASA Ames Research Park, MS 244-30, Building 244, Room 107A, Moffett Field, CA 94035-1000 10 Institute for Computational Astrophysics, Department of Astronomy and Physics, Saint Marys University, Halifax, NS B3H 3C3, Canada 11 Département de physique, Université de Montréal, C.P. 6128, Succ. Centre-Ville, Montréal, QC H3C 3J7, and Observatoire du mont Mégantic, Canada 12 Department of Astronomy and Astrophysics, David Dunlap Observatory, University of Toronto, P.O. Box 360, Richmond Hill, ON L4C 4Y6, Canada 13 Harvard–Smithsonian Center for Astrophysics, 60 Garden Street, Cambridge, MA 02138

Received ; accepted

ABSTRACT

Context. The central star of the HR 8799 system is a γ Doradus-type pulsator. The system harbours four planetary-mass companions detected by direct imaging, and is a good solar system analogue. The masses of the companions are not known accurately, because the estimation depends strongly on the age of the system, which is also not known with sufficient accuracy. Asteroseismic studies of the star might help to better constrain the age of HR 8799. We organized an extensive photometric and multi-site spectroscopic observing campaign for studying the pulsations of the central star.

Aims. The aim of the present study is to investigate the pulsation properties of HR 8799 in detail via the ultra-precise 47-d-long nearly continuous photometry obtained with the MOST space telescope, and to find as many independent pulsation modes as possible, which is the prerequisite of an asteroseismic age determination.

Methods. We carried out Fourier analysis of the wide-band photometric time series.

Results. We find that resonance and sudden amplitude changes characterize the pulsation of HR 8799. The dominant frequency is always at f_1 = 1.978 d^{−1}. Many multiples of one ninth of the dominant frequency appear in the Fourier spectrum of the MOST data: n/9 f_1, where n = {1, 2, 3, 4, 5, 6, 7, 8, 9, 10, 13, 14, 17, 18}. Our analysis also reveals that many of these peaks show strong amplitude decrease and phase variations even on the 47-d time-scale. The dependencies between the pulsation frequencies of HR 8799 make the planned subsequent asteroseismic analysis rather difficult. We point out some resemblance between the light curve of HR 8799 and the modulated pulsation light curves of Blazhko RR Lyrae stars.

Key words. Techniques: photometric – Stars: individual: HR 8799 – Stars: oscillations

1. Introduction

HR 8799 (HD 218396, V342 Peg, α_{2000} = 23^h07^m28.^s71, δ_{2000} = +21^∘08^′03.^{′′}3) is a bright (V = 5.95 mag) A5V star, showing λ-Bootis-type metallic-abundance anomalies (Sadakane 2006), and γ Dor pulsations (Zerbi et al. 1999).

⋆ Based on data from the MOST satellite, a Canadian Space Agency mission, jointly operated by Dynacon Inc., the University of Toronto Institute for Aerospace Studies and the University of British Columbia, with the assistance of the University of Vienna.

⋆⋆ Currently a voluntary collaborator at the Royal Observatory of Belgium, Ringlaan 3, B-1180 Brussel, Belgium

The system of HR 8799 is one of the very few known true solar system analogues (Matthews et al. 2014). It hosts four planetary-mass companions detected by direct imaging (Marois et al. 2008, 2010), and circumstellar dust disk with warm, cold and external halo components (Sadakane & Nishida 1986; Reidemeister et al. 2009; Su et al. 2009). The debate over the age of the system is still unsettled, as different methods give significantly different ages (see, e.g., Moro-Martín et al. 2010). Since the masses of the companions are derived from their luminosities using theoretical cooling tracks, the mass determination is very sensitive to the age of the system.

The oscillations of HR 8799 were previously studied via ground-based photometric campaigns by Zerbi et al. (1999, Z99

Article number, page 1 of 8

A&A proofs: manuscript no. sodor

Fig. 1. The cleaned MOST light curve of HR 8799, containing 57 094 data points. The visible periodic gaps are due to the removal of the data points affected by stray light contamination reflected from the surface of the Earth.

hereafter) and Cuypers et al. (2009, C09 hereafter), and spectroscopically by Mathias et al. (2004) and Wright et al. (2011).

The first asteroseismic age determination was performed by Moya et al. (2010), who derived different possible age ranges based on three pulsation frequencies published by Z99, using the frequency ratio method. The obtained asteroseismic age is not well constrained; it depends on the inclination of the star. If the inclination is either around 36^∘ or around 50^∘, then the possible age ranges are either [26, 430] and [1123, 1625], or [1126, 1486] Gyr, respectively. The inclination of the rotation axis of the central star is often assumed to be aligned with the inclination of the planetary system. On one hand, the orbits of the companions are seen about face-on, but the real inclination angles are not well constrained, because the orbital periods are in the 50– 500 yr range, and the orbital displacements of the companions were small since their first detection. The best estimation of the inclination of the orbital plane, assuming co-planarity between the companions, is i_{orb} = 28^∘ (Esposito et al. 2013). On the other hand, analysis of the spectroscopic line-profile variations, caused by the pulsation, suggests that the central star is visible at higher inclination; i_{rot} ≳ 40^∘ (Wright et al. 2011). Note that alignment between the rotation and pulsation axis is assumed in this estimation. Thus, a misalignment of Δi > 10^∘ between the inclination of the orbits and the rotational inclination of the central star seems probable.

To facilitate the asteroseismic study of HR 8799, we obtained photometric observations with the MOST space telescope in 2009, and also organized an extended multi-site spectroscopic observing campaign around the time of the MOST observations. The light curve shows interesting phenomena detected at the first time in γ Dor pulsators. The interpretation of the spectroscopic data is a complex task in itself, therefore, we analyse only the photometric data in the present study. The investigation of the spectroscopic time series is planned in a forthcoming paper.

2. Observations and data preparation

This study is based on the space photometry obtained by the Microvariability and Oscillations of STars (MOST) microsatellite nearly continuously over a 47-d-long period in 2009, between 15 August and 1 October (HJD 2 455 059–106).

MOST contains a 15-cm Rumak-Maksutov telescope imaging onto a CCD detector via a custom optical broadband filter (350–750 nm; Walker et al. 2003; Matthews et al. 2004). From its polar Sun-synchronous orbit of altitude 820 km and period 101 min, MOST has a continuous viewing zone of about 54^∘ wide within which it can monitor target fields for up to two months without interruption. Targets as bright as HR 8799 are projected onto the science CCD as a fixed Fabry image of the telescope entrance pupil covering some 15 000 pixels. The photometry is non-differential, but given the orbit, thermal and design characteristics of MOST, experience has shown that it is a very photometrically stable platform even over long timescales (with repeatability of the mean instrumental flux from a nonvariable target of the brightness of HR 8799 to within about 1 mmag over a month).

Due to the failure of the tracking CCD, the science exposures on the MOST science CCD now take place at the same time as the guide-star exposures for satellite pointing. In the case of the HR 8799 observations, the guide-star exposure time (and hence also the science target exposure time) was 0.3 sec. To build up sufficient signal-to-noise ratio (S/N), the science exposures were added on board the satellite in “stacks” of 100 exposures, each stack corresponding to 30 sec of total integration. Stacks were downloaded from the satellite consecutively, with no dead time between stacks, giving a sampling rate of about twice per minute. A total of 101,954 individual data-points have been obtained. However, due to a very high background occurring at each orbit caused by the stray light contamination reflected from the surface of the Earth, a total of ∼40 000 points had to be removed, leaving periodic gaps in the light curve.^1 After removing several other outliers, we obtained the final cleaned light curve consisting in 57 094 data points, shown in Fig. 1. We used these data for analysis. The typical 1σ errorbar of a single data point is 1 mmag. The light curve is available from the authors upon request.

3. Light-curve analysis

We used the LCfit (Sódor 2012) software and other in-house developed tools for the following analysis. The frequency identification and light-curve prewhitening was performed in a standard way. A more detailed description of the procedure can be found in Sódor et al. (2014).

1 In fact, a 0.1 phase range is completely missing from the light curve, if phased with the orbital frequency, 14.1883 d^{−1}. This causes the prominent peak at this frequency in the spectral window function, shown in Fig. 2

Article number, page 2 of 8

Á. Sódor et al.: MOS T light-curve analysis of the γ Dor pulsator HR 8799, showing resonances and amplitude variations

Fig. 2. Fourier amplitude spectrum of the MOST light curve of HR 8799. The actual spectrum is shown in the positive amplitude range, while the 28-frequency solution, listed in Table 1, is represented by thick vertical lines in the negative amplitude range. Instrumental frequency components are marked by dotted lines. The most prominent frequencies and frequency groups are labelled. The n/9 f_1 frequency grid is indicated by dashed gray lines. The insert shows the window function of the data. The only high-amplitude alias is at the orbital frequency of the satellite, which causes aliasing only far out of the investigated range.

3.1. Frequency identification

The Fourier amplitude spectrum of the light curve is shown in Fig. 2. We looked for significant periodicities with S/N > 4 in the 0–10 d^{−1} frequency range. We do not investigate higher frequency domains, because those parts of the spectrum are contaminated by artefacts originating from the satellite and caused by the 14.2 d^{−1} aliasing of the orbital frequency. Since γ Dor pulsation frequencies are below 10 d^{−1}, this limitation does not affect our study.

Altogether, 28 significant frequency components were identified with S/N > 4. The noise level was calculated before each prewhitening step as a moving average of the amplitude spectrum with a 5 d^{−1} window size. Two of the significant frequencies are identified as instrumental artefacts. f_{sid} = 1.0026 d^{−1} is the sidereal frequency, while the lowest-frequency component, f_{low} = 0.013 d^{−1}, which is below the Rayleigh limit^2, thus describes a periodicity longer than the observation period, is also not considered to be intrinsic to the star. The frequencies and amplitudes of the 28-frequency solution are plotted together with the Fourier periodogram in Fig. 2, and are listed in Table 1. Note that the stellar-origin and instrumental frequencies were treated in the same way during prewhitening.

The (O−C) of the 28-frequency fit is 3.2 mmag, significantly larger than the 1 mmag uncertainty of the individual data points. The residual spectrum is plotted in Fig. 3. It shows extended noise below 5 d^{−1}, which is partially due to residual peaks around the detected significant peaks caused by the amplitude and frequency variations (see details in Sect. 3.4). Further signals intrinsic to the star but of amplitudes below the detection limit might contribute to the increased noise in this low-frequency range. Also, instrumental noise is typically higher at low frequencies.

The bottom panel of Fig. 3 plots the residual spectrum of the light curve up to 100 d^{−1}. We can see an increase in the noise level around each harmonic of the orbital frequency, f_{orb} = 14.2 d^{−1}, which is the aliasing of the extended noise below 5 d^{−1}.

2 The Rayleigh resolution limit is calculated as 1/T , where T is the total time span of the light curve.

Fig. 3. Prewhitened Fourier spectrum of the MOST light curve of HR 8799, after the subtraction of the 28 frequencies listed in Table 1. Dashed curves show the 4σ noise level. Vertical dashed lines in the bottom panel and in the ’Window function’ insert panel mark the multiples of the orbital frequency ( f_{orb} = 14.2 d^{−1}) of MOST. The bottom panel shows the residual spectrum up to 100 d^{−1}, while the top panel is a blow-up of the investigated frequency range.

Only several harmonics of f_{orb} and high-order linear combinations of f_{orb} and f_{sid} exceed the 4σ noise level.

There is no sign of δ Scuti pulsation with amplitude higher than ∼ 0.7 mmag in the 10–20 d^{−1} range and with amplitude higher than ∼ 0.2 mmag above 20 d^{−1} in HR 8799.

3.2. Resonances

The light variations and the Fourier periodogram are dominated by a strong signal at f_1 = 1.98 d^{−1}, while the second highest peak is at f_2 = 1.10 d^{−1}. The ratio of these two frequencies is f_1/ f_2 = 1.8 = 9/5, showing resonance. Note that f_2 is off only by 0.02-times the Rayleigh resolution from 5/9 f_1, that is, the resonance is well established. Furthermore, the arrangement of the significant frequencies follows a conspicuous regular pattern.

Article number, page 3 of 8

A&A proofs: manuscript no. sodor

Table 1. Frequencies detected with S/N > 4 in the MOST light curve of HR 8799. Standard errors of the frequencies are given in parentheses in the unit of the last digit. Cols. 6 and 8 give the deviation of the actual frequency (Col. 2) from the linear combination and from the exact n/9 f_1 resonance (Cols. 5 and 7), respectively, and are given in the unit of the Rayleigh resolution limit (Rl = 0.021 d^{−1}). The frequencies in the bottom two lines are not considered to be intrinsic to HR 8799.

ID Frequency Ampl. S/N linear combination deviation resonance deviation (d^{−1}) (mmag) (Rl) (1/9 f_1) (Rl) f_1 1.97984(01) 14.74 70.6 f_2 1.10033(02) 9.62 42.9 5 0.02 f_{3A} 1.76316(09) 5.81 25.4 2( f_1 − f_2) 0.2 8 0.2 f_{3B} 1.74065(11) 5.69 25.7 2( f_1 − f_2) −0.9 8 −0.9 f_{3C} 1.72305(13) 6.14 31.8 2( f_1 − f_2) −1.7 8 −1.8 f_4 0.88071(04) 5.98 29.4 f_1 − f_2 0.06 4 0.04 f_{5A} 0.21522(12) 3.24 14.4 f_1 − f_{3A} −0.1 1 −0.2 f_{5B} 0.23959(23) 2.29 10.2 f_1 − f_{3B} 0.002 1 1.0 f_{5C} 0.25646(25) 2.28 9.4 f_1 − f_{3C} −0.01 1 1.7 f_6 3.07858(12) 1.90 10.6 f_1 + f_2 −0.08 14 −0.05 f_7 1.87386(12) 2.10 9.9 f_{8B} 0.64421(18) 1.81 8.0 f_{3B} − f_2 0.2 3 −0.7 f_{8C} 0.62575(17) 1.99 8.9 f_{3C} − f_2 0.14 3 −1.6 f_9 1.68339(19) 1.73 8.4 f_{10} 2.86332(15) 1.52 8.2 2 f_1 − f_2 0.2 13 0.2 f_{11} 3.95842(21) 1.10 6.8 2 f_1 −0.06 18 −0.06 f_{12A} 3.74450(35) 0.72 4.5 f_1 + f_{3A} 0.3 17 0.2 f_{12C} 3.71023(24) 1.03 6.3 f_1 + f_{3C} 0.3 17 −1.4 f_{13A} 1.54171(30) 1.49 6.2 7 0.1 f_{13B} 1.52643(36) 1.27 5.3 7 −0.6 f_{14A} 1.30868(26) 0.96 4.7 f_1 + f_2 − f_{3A} −0.4 6 −0.5 f_{14C} 1.36057(20) 1.26 5.7 f_1 + f_2 − f_{3C} 0.2 6 1.9 f_{15A} 0.45956(26) 0.94 4.5 2 0.9 f_{15B} 0.40207(27) 0.92 4.2 2 −1.8 f_{16} 1.13345(31) 0.91 4.3 5 1.6 f_{17} 2.19911(27) 0.89 4.0 2 f_2 −0.1 10 −0.03

f_{sid} 1.00261(19) 1.30 5.4 f_{low} 0.01344(38) 1.43 5.8

Many frequencies are aligned with the integer multiples of f_1/9. This frequency grid is also indicated in Fig. 2.

3.3. Linear combinations

In connection with the alignment of the frequencies with the n/9 f_1 grid, many linear-combination frequencies can be identified. However, the parent–child or base–combination relations in the linear-combination identification are ambiguous.

A simple description to explain the frequency alignments with the n/9 f_1 grid would be to choose f_{5A} ≈ 1/9 f_1 as the base frequency, in which case, the other aligned frequencies would be integer multiples of this one. However, f_{5A} itself is not quite well aligned with the n/9 f_1 grid, and such a solution does not take into account the amplitude relations of the components.

A standard method for identifying linear combinations is to demand both base frequencies to have higher amplitudes than that of the combination frequency. Following this way, we can identify five base frequencies ( f_1, f_2, f_{3A}, f_{3B}, f_{3C}), of which the latter three are related, and many combinations of these. Only two intrinsic frequencies ( f_7 and f_9) cannot be described either as combination of these five bases or n/9 f_1 multiples. This identification is listed in Table 1.

3.4. Amplitude and phase variations

The Fourier decomposition of the observed time series assumes stationary harmonic components. If this assumption is not met, in the case when the amplitude and/or phase of a sinusoidal component changes during the observations, the Fourier analysis of the data will show bunching of frequencies in a small range, with separations of the order of the Rayleigh resolution.

We find such close frequencies in HR 8799, forming groups. We denote the group members with A, B, and C subscripts in Table 1, while we refer to the whole group by omitting the A, B, and C subscripts. The most prominent of these groups is the f_3 group around 8/9 f_1, which, together with f_1 and f_2, appears to be a linear-combination base of other groups. The highestamplitude linear-combination group is f_5 = f_1 − f_3, around 1/9 f_1.

On one hand, the f_3 group and its linear-combination groups might represent amplitude and phase variations of a single pulsation mode and its linear-combinations, respectively. On the other hand, it is also possible that the group components are independent frequencies present in HR 8799, and we actually observe beating of these poorly resolved components. The limited time coverage of 47 d of the MOST dataset makes it difficult to discriminate between these two possibilities.^3

3 Unfortunately, the longer time-base spectroscopic data are also not quite suitable to decide this question. Even though the frequency resolution of the spectroscopic data is much better than that of the presently

Article number, page 4 of 8

Á. Sódor et al.: MOS T light-curve analysis of the γ Dor pulsator HR 8799, showing resonances and amplitude variations

We investigated the suspected variations in the frequency components by dividing the data into three equally long subsets, each covering 15.5 d. We performed the same frequency identification on the subsets as previously on the full dataset. The Fourier periodograms and the identified frequency components of the subsets are plotted in Fig. 4.

The spectra of the three subsets clearly show variations. Such variations are expected in any of the two possible cases, described above. Only the amplitude of f_1 and f_2 remained stable during the 47-d-long MOST observations, while all the other components detected in the shorter subsets underwent amplitude decrease.^4 The observed overall amplitude decrease in many frequency components suggests that we indeed see amplitude variations instead of beating between close, poorly resolved frequency components. In the latter case, both amplitude increase and decrease would be expected among the changing components. The double peak of f_3 and the frequency shifts of f_3, f_5 and f_8 in the middle time segment hints that most of the variations occurred during this interval.

A single gradual amplitude decrease event does not cause multiple peaks in the resultant Fourier spectrum; only the corresponding peak becomes somewhat broadened. Thus, the peak multiplets that form the groups in the Fourier spectrum of HR 8799, are signs of frequency or phase variations accompanying the amplitude decrease.

Breger & Montgomery (2014) identified parent–child relations of resonantly coupled linear-combination frequencies in the extended Kepler light curve of a δ Scuti star, KIC 8054146. Their identification scheme relies on relations between the amplitudes and phases of the parents and their child component. Since not all the terms are known in their formula (eq. 5), it is necessary to detect amplitude and/or phase variations for establishing the parent–child relation. Observing variations in both parents, they were able to predict the amplitude and phase of the child with an unexpected accuracy for 20 separate time segments.

Our data on HR 8799 are not extended enough to make similar quantitative predictions, but we can check our linearcombination identifications qualitatively, at least for the highestamplitude combination frequencies, f_4, f_5 and f_8. Among the three frequencies considered to be bases ( f_1, f_2 and f_3), only the last one changed.

Both f_5 and f_8 show a strong amplitude decrease from the first to the third time segment. In fact, f_8 disappeared completely. This, and the apparent frequency shifts and the frequency finestructure in the complete dataset suggests that f_5 and f_8 are indeed linear combinations of f_3 with f_1 and f_2, respectively, as Table 1 lists.

We cannot explain, however, the amplitude decrease of f_4 this way. The straightforward explanation for the frequency itself would be f_4 = f_1 − f_2, as listed in Table 1, but in this case we would not expect amplitude variation, since both parents are stable. We assume that f_3 is also involved in this component. An alternative expression is f_4 = f_2 − ( f_1 − f_3) = f_2 − f_1 + f_3 to describe this component. This is possible because f_4 is in 1:2

studied photometry, the uneven distribution of the spectroscopic data poses another difficulty. We will revisit this question in the forthcoming spectroscopy paper on HR 8799.

4 Note that f_{10} and f_6 were only detected in the last time segment. These two frequencies have amplitudes around the detection limit, and their detection only in the last third can be explained by the different noise statistics of the three data subsets. The 1σ levels of the three residual spectra are 0.08, 0.06 and 0.04 mmag around 9 d^{−1} for the first, middle and last segments, respectively.

Fig. 5. The light curve of HR 8799 phased with the beating frequency 1/9 f_1 ≈ f_1 − f_{3A}. The time zero point was chosen to give the main peak at phase 0.5.

resonance with f_3. f_3 can influence the amplitude of f_4 either through the linear combination or through the 1:2 resonance.

4. Blazhko-like behaviour of HR 8799

The amplitude and phase modulation of the light curves observed in a large fraction of RR Lyrae stars, the so-called Blazhko effect, is a long-standing, still unresolved problem of astrophysics (Kolenberg 2012). Recent continuous observations of the Kepler space telescope revealed that period doubling (PD) – alternating higher and lower light maxima and minima – also often occur in Blazhko RR Lyrae stars (Kolenberg et al. 2010).

Although the physical background of the phenomenon might be completely different in HR 8799, we point out some interesting resemblance of the light variations and the Fourier spectra of this star and those of Blazhko RR Lyrae stars.

A periodic amplitude modulation of the pulsation can be seen in Fig. 1. The modulation period of about 4.5 d corresponds to 1/9 f_1 ≈ f_1 − f_{3A}, that is, we see beating between two strong periodicities. The light curve phased with 1/9 f_1 is shown in Fig. 5. This plot shows not only the nice periodic amplitude modulation, but also PD: the brightest maxima at phase 0.5 are always preceded by weak ones, and are followed by weak ones, then stronger ones, then weaker maxima again.

Amplitude and phase modulation appear in the frequency domain as modulation side-peaks situated around a main peak with equidistant separation (Szeidl & Jurcsik 2009). PD corresponds to half-integer frequencies of the main peak in frequency domain. Z99 already raised the possibility that we actually see modulation of the dominant periodicity of HR 8799 in the periodogram, as the dominant frequency, f_1, was accompanied by another one at 1.73 d^{−1} in their data ( f_3 in our analysis). However, they rejected this explanation afterwards, as they could not find the higher-frequency modulation side peak around f_1, with amplitude approximately equal to the lower-frequency one. Later, theoretical studies and observations showed that the amplitudes of the lower- and higher-frequency modulation components may differ significantly (Szeidl & Jurcsik 2009), even to the extent that the lower-amplitude one remains undetected (Jurcsik et al. 2005).

All these provide the basis for an alternative explanation of the structure of the Fourier spectrum of HR 8799. According to this description, f_1 and f_2 are still base frequencies, while the third one is f_{mod} = 1/9 f_1 ≈ f_5, the modulation frequency. In Fig. 2, we can identify the symmetrically situated modulation peaks (± f_{mod}) around f_1, f_2, 2 f_1, and f_1 + f_2. The lowerfrequency side-peaks have always much higher amplitudes than

Article number, page 5 of 8

A&A proofs: manuscript no. sodor

Fig. 4. Variations in the frequency content of the MOST light curve of HR 8799. Fourier amplitude spectra of the first (gray/red full line), middle (gray/green dash-dotted line) and last (black/blue dashed line) third of the data are plotted with curves in the positive amplitude range, while the frequency components identified in the respective time segments, down to the 4σ level, are plotted with vertical lines in the negative amplitude range. The horizontal lines at the lower end of these lines are added only for better visibility of the overlapping ones.

the higher-frequency ones, so that these are detectable above the noise only for the two highest-amplitude peaks, f_1 and f_2. The MOST data actually reveal the higher-frequency modulation side peak of the dominant pulsation mode: f_1 + f_{mod} = f_{17}, which could not be detected by Z99. The modulation frequency in this description undergoes variations even on the 47-d time span of the data. Although on longer timescales, such variations are known in Blazhko RR Lyrae stars, too (e.g., Sódor et al. 2011).

Another possibility is that f_2 is, in fact, not an independent pulsation mode, but, together with f_4, is the expression of PD. The PD is related to the 9:5 and 9:4 ratio between f_1: f_2 and f_1: f_4, respectively. As often is the case also in RR Lyrae stars, the half-integer frequencies are offset somewhat from the exact (2k + 1)/2 f_{puls} values, in relation with the temporal variation in the PD itself (Szabó et al. 2010). The large offset of ±1/18 f_1 in HR 8799 is necessary because of the resonances involving the number nine, which is not divisible by two, and because of the quite regular nature of the PD. Due to the 1:9 resonance, the length of one modulation cycle is exactly nine times the length of the dominant pulsation cycle. Furthermore, as Fig. 5 demonstrates, a high maximum occurs for every ninth pulsation. Therefore, the high-low-high amplitude alternation has to turn to the other way exactly within one modulation cycle, and then back to the original within another one. All these can be considered as the 1/2 f_1 and 3/2 f_1 half-integer frequencies of the PD are modulated with the f_{mod}/2 frequency. We indeed see f_2 and f_4 exactly at 1/2 f_1 ± f_{mod}/2, while, f_{10} and f_6 are situated exactly at 3/2 f_1 ± f_{mod}/2.

5. Discussion

The pulsation of HR 8799, as revealed by the ultra-precise MOST photometry, is not a typical multi-periodic γ Dor pulsation. We detected significant amplitude and frequency variations even during the 47 days of the MOST observations. Resonance also plays a very important role in the pulsation of HR 8799. Two previously published studies already investigated the frequency content of HR 8799 in photometric observations (Z99,C09);

therefore, we discuss our frequency analysis results in comparison with the earlier analyses.

5.1. f_1 = 1.98 d^{−1}

The only frequency that can be considered with certainty to correspond to an independent mode is the dominant one, f_1. This signal was detected in all previous photometric runs, with frequencies agreeing within the corresponding Rayleigh resolution limits. The measured amplitudes are also similar in each epoch. This frequency was always the dominant one.

Two earlier works published frequencies and corresponding multi-colour amplitudes from time-series photometric runs of HR 8799. Since these works are based on different photometric bands, direct comparison of the amplitudes is not possible, but we still can perform a rough quantitative analysis. Z99 (table 2) give a Johnson V amplitude of 16 mmag for this frequency. C09 (table 24) list amplitudes in seven Geneva bands, where V is 16 mmag, too, while the highest amplitude, 22.2 mmag is seen in the B2 band, corresponding to 450 nm wavelength. The white-light passband of MOST covers the 350–750 nm wavelength range, including the whole Geneva range and extending further towards the red. The 14.7 mmag amplitude of f_1 in the MOST data is consistent with the previous observations because of the large contribution of red light where the pulsation amplitude is lower. Consequently, there is no sign of significant frequency and amplitude variation of the f_1 component over the 14-yr time base covered by the three datasets (between 1995 and 2009).

5.2. f_2 = 1.10 d^{−1}

This component is stable over the time span of the the MOST observations, and it is also the second strongest signal in the full dataset. Nevertheless, it was not reported by earlier studies. This means that this frequency either was not present in earlier data at all, or its amplitude was much lower than during the MOST measurements. Checking the residual spectrum of the data of Z99 in the lower left panel of their fig. 2, we can estimate the

Article number, page 6 of 8

Á. Sódor et al.: MOS T light-curve analysis of the γ Dor pulsator HR 8799, showing resonances and amplitude variations

upper limit of the amplitude of this frequency at that time. Its amplitude was no more than 1/5 of the amplitude of f_1.

This frequency is in 5:9 resonance with the dominant frequency, f_1, which might be responsible for its temporal excitation.

Another possibility is that this frequency corresponds to the rotation of the star, if we assume a temperature spot on the surface that modulates the observed brightness. A star spot with life time and migration time scale longer than the 47-d-long MOST data, but shorter than several years explains the stability of this periodicity over our observing run, and also why this frequency was not detected in earlier data. Using stellar parameters of Wright et al. (2011, table 2), this rotation frequency yields an inclination in the 23–37^∘ range, similar to the orbital inclination.

Note that we detected a low-amplitude peak, f_{16}, separated only by 1.6 times the Rayleigh resolution limit from f_2. This component might be an indication of a slight amplitude and/or phase change in f_2. However, according to Fig. 4, its effect on f_2 is marginal during the MOST observing run.

5.3. f_3 ≈ 1.75 d^{−1} and f_1 − f_3 ≈ 0.23 d^{−1}

The signal we denote as f_3 appears in each of the three photometric investigations with relatively high amplitude. Its amplitude is only slightly below that of the dominant f_1 in the Geneva photometry of C09, while Z99 report its amplitude being only about half of the amplitude of f_1. The difference of this and the dominant frequency, f_1 − f_3 ≈ 0.23 d^{−1} (or its −1 d^{−1} alias, 0.77 d^{−1}) is also detected by all three studies.

This component is highly variable in the MOST data, both in amplitude and in frequency, while there is no sign of frequency variation in the 4-season-long Geneva photometry of C09. Also, the 1.73 d^{−1} frequency found by C09 is consistent with that of Z99.

According to Fig. 4, f_3 is almost in 8:9 resonance with f_1, however its actual value is apparently below the exact resonance. This slight off-resonance with the dominant frequency might cause the rather short-term amplitude and frequency changes. Such behaviour can be induced as the assumed resonantly coupled mode is sometimes phase-locked with the exact resonance frequency, while at other times it is not. The somewhat lower frequency of this signal reported by Z99 and C09 was probably sufficiently off-resonance at those times, thus the amplitude was probably not influenced by resonance with f_1.

5.4. f_9 = 1.68 d^{−1}

We note the possibility that the third frequency component Z99 found at 1.65 d^{−1} with amplitude similar to that of the component at 1.73 d^{−1}, might originate from frequency and amplitude variations of one signal. On the other hand, it also might be an independent frequency. We also identified an apparently independent frequency component, f_9 = 1.68 d^{−1}, marginally consistent with the third frequency of Z99. Regardless that it corresponds to the same pulsation mode as f_9 of the MOST data or not, the 1.65 d^{−1} component of Z99 also underwent amplitude changes. It was undetected in the C09 data, while its amplitude decreased significantly for the MOST observations.

5.5. n:9 resonances

The earlier studies of HR 8799 did not find resonances between the detected frequencies.

The n:9 resonances between most of the identified frequencies and the dominant frequency in HR 8799 is a new phenomenon amongst γ Dor pulsators. No similar n:m resonances were reported in any γ Dor variable previously. Also, only one δ Sct pulsator is known where n:3 resonances were identified, quite recently, in CoRoT space photometry (HD 51844, Hareter et al., submitted for publication).

The fact that all the identified resonances are of n/9 f_1 form, and that no other than 1/9 fractions of the dominant frequency are involved, suggest that the 1/9 f_1 frequency itself has some physical relevance. However, the 1/9 f_1 component, f_5, seems to be much more unstable, both in amplitude, and in frequency or phase, than f_1 itself. We note that 1/9 f_1 = 0.22 d^{−1} definitely cannot be the rotation frequency of HR 8799. Considering the stellar parameters given by Wright et al. (2011), calculating with the most extreme parameter values from the uncertainty ranges (R = 1.8 R_⊙, v sin i = 36 km/s, i = 90^∘), the lowest possible rotation frequency is 0.39 d^{−1}.

The physical explanation of the n:9 resonances is unknown, and they add another puzzle to asteroseismology.

6. Summary

– 47 days of almost continuous light curve of HR 8799 obtained by the MOST spacecraft was analysed.

– 26 intrinsic frequencies were identified.

– Many of these frequencies are aligned with an n/9 f_1 grid defined by the dominant frequency, f_1 = 1.98 d^{−1}. This alignment suggests resonant coupling between the aligned frequencies and f_1.

– Some frequencies form groups, suggesting a single underlying signal that underwent amplitude decrease and frequency variations during the 47-d-long observing run.

– The light curve of HR 8799 and its Fourier periodogram shows interesting resemblance to the light curves and Fourier spectra of Blazhko RR Lyrae pulsators. The modulation frequency is ∼ 1/9 f_1, and shows short-term variations. Strong period doubling is also visible.

7. Conclusion

The identification of independent pulsation modes in the MOST light curve and in previously published photometric data of HR 8799 is rather difficult, because of the resonances. The pulsation frequencies interact and mutually depend on one another. Their amplitudes change on rather short time scales. We cannot unambiguously determine which are the independent parent frequencies, which detected signals are resonantly coupled child modes, and which are linear-combination frequencies. Also, if resonant phase-locking occurs, the detected frequency might be shifted compared to its unperturbed theoretical frequency.

We note that Moya et al. (2010) determined the age of HR 8799 using three frequencies published by Z99. However, as we mentioned above, two of these, detected around our f_3 might actually originate from a single mode that underwent amplitude and frequency variations during the observing run. Also, the frequency of the f_3 signal may be affected by resonance.

The only stable and relatively high-amplitude component of the pulsation of HR 8799 is the dominant frequency, f_1. This can unambiguously be accepted as an independent pulsation mode. We only found two frequencies that appear to be independent from f_1. These are f_7 and f_9, however, both are of low amplitude.

Article number, page 7 of 8

A&A proofs: manuscript no. sodor

The primary goal of the MOST observations of HR 8799 was to find as many independent pulsation modes as possible, in order to facilitate asteroseismic modelling, in particular, to determine the asteroseismic age of the system, independently from the work of Moya et al. (2010). Due to the mentioned problems, the asteroseismic age determination seems to be difficult to achieve at this point. As we mentioned in the introduction, we also collected rather extended high-resolution spectroscopic data on HR 8799 during the 2008–2009 seasons. The analysis of these data will hopefully help to identify several independent pulsation modes, necessary to proceed with the asteroseismic age determination.

Acknowledgements. Á.S. acknowledges support by the Belgian Federal Science Policy (project M0/33/029, PI: P.D.C.) and by the János Bolyai Research Scholarship of the Hungarian Academy of Sciences. W.W. acknowledges support by the Austrian Science Fonds (FWF) P22691-N16.

References

Breger, M. & Montgomery, M. H. 2014, ApJ, 783, 89 Cuypers, J., Aerts, C., De Cat, P., et al. 2009, A&A, 499, 967 Esposito, S., Mesa, D., Skemer, A., et al. 2013, A&A, 549, A52 Jurcsik, J., Szeidl, B., Nagy, A., & Sódor, Á. 2005, Acta Astron., 55, 303 Kolenberg, K. 2012, Journal of the American Association of Variable Star Observers (JAAVSO), 40, 481 Kolenberg, K., Szabó, R., Kurtz, D. W., et al. 2010, ApJ, 713, L198 Marois, C., Macintosh, B., Barman, T., et al. 2008, Science, 322, 1348 Marois, C., Zuckerman, B., Konopacky, Q. M., Macintosh, B., & Barman, T.

2010, Nature, 468, 1080 Mathias, P., Le Contel, J.-M., Chapellier, E., et al. 2004, A&A, 417, 189 Matthews, B., Kennedy, G., Sibthorpe, B., et al. 2014, ApJ, 780, 97 Matthews, J. M., Kuschnig, R., Guenther, D. B., et al. 2004, Nature, 430, 51 Moro-Martín, A., Rieke, G. H., & Su, K. Y. L. 2010, ApJ, 721, L199 Moya, A., Amado, P. J., Barrado, D., et al. 2010, MNRAS, 405, L81 Reidemeister, M., Krivov, A. V., Schmidt, T. O. B., et al. 2009, A&A, 503, 247 Sadakane, K. 2006, PASJ, 58, 1023 Sadakane, K. & Nishida, M. 1986, PASP, 98, 685 Sódor, Á. 2012, Konkoly Observatory Occasional Technical Notes, 15, 1 Sódor, Á., De Cat, P., Wright, D. J., et al. 2014, MNRAS, 438, 3535 Sódor, Á., Jurcsik, J., Szeidl, B., et al. 2011, MNRAS, 411, 1585 Su, K. Y. L., Rieke, G. H., Stapelfeldt, K. R., et al. 2009, ApJ, 705, 314 Szabó, R., Kolláth, Z., Molnár, L., et al. 2010, MNRAS, 409, 1244 Szeidl, B. & Jurcsik, J. 2009, Communications in Asteroseismology, 160, 17 Walker, G., Matthews, J., Kuschnig, R., et al. 2003, PASP, 115, 1023 Wright, D. J., Chené, A.-N., De Cat, P., et al. 2011, ApJ, 728, L20 Zerbi, F. M., Rodríguez, E., Garrido, R., et al. 1999, MNRAS, 303, 275

Article number, page 8 of 8