arXiv:1406.3628v2 [astro-ph.CO] 4 Aug 2014

Accepted for publication in Astrophysical Journal Preprint typeset using L^ATEX style emulateapj v. 5/2/11

CONSTRAINING THE VARIATION OF THE FINE STRUCTURE CONSTANT WITH OBSERVATIONS OF NARROW QUASAR ABSORPTION LINES^1

A. Songaila & L. L. Cowie Institute for Astronomy, University of Hawaii, 2680 Woodlawn Drive, Honolulu, HI 96822 Accepted for publication in Astrophysical Journal

ABSTRACT The unequivocal demonstration of temporal or spatial variability in a fundamental constant of nature would be of enormous significance. Recent attempts to measure the variability of the fine structure constant α over cosmological time, using high resolution spectra of high redshift quasars observed with 10m class telescopes, have produced conflicting results. We use the Many Multiplet (MM) method with Mg II and Fe II lines on very high signal-to-noise, high resolution (R = 72, 000) Keck HIRES spectra of eight narrow quasar absorption systems. We consider both systematic uncertainties in spectrograph wavelength calibration and also velocity offsets introduced by complex velocity structure in even apparently simple and weak narrow lines and analyze their effect on claimed variations in α. We find no significant change in α, Δα/α = (0.43 ± 0.34) × 10^{−5}, in the redshift range z = 0.7 − 1.5, where this includes both statistical and systematic errors.

We also show that the scatter in measurements of Δα/α arising from absorption line structure can be considerably larger than assigned statistical errors even for apparently simple and narrow absorption systems. We find a null result of Δα/α = (−0.59±0.55)×10^{−5} in a system at z = 1.7382 using lines of Cr II, Zn II and Mn II, whereas using Cr II and Zn II lines in a system at z = 1.6614 we find a systematic velocity trend which, if interpreted as a shift in α, would correspond to Δα/α = (1.88 ± 0.47) × 10^{−5}, where both results include both statistical and systematic errors. This latter result is almost certainly caused by varying ionic abundances in subcomponents of the line: using Mn II, Ni II and Cr II in the analysis changes the result to Δα/α = (−0.47 ± 0.53) × 10^{−5}. Combining the Mg II and Fe II results with estimates based on Mn II, Ni II and Cr II gives Δα/α = (−0.01 ± 0.26) × 10^{−5}. We conclude that spectroscopic measurements of quasar absorption lines are not yet capable of unambiguously detecting variation in α using the MM method.

1. INTRODUCTION

There has been much interest over the last decade in the possibility that fundamental dimensionless constants may evolve or in some way be a product of the history of the region in which they lie (Uzan 2003). In the case of the fine-structure constant, α, one group has claimed to see such time variation (Murphy et al. 2003a,b, 2004; Webb et al. 2003) and spatial variation (Webb et al. 2011, 2014; King et al. 2012) using the “many multiplet” (MM) method of analyzing quasar absorption line spectra, which they pioneered (Webb et al. 1999; Dzuba et al. 1999b,a). However, this positive result is limited to one group and more stringent null results, using the same methodology, have been reported (Srianand et al. 2004; Chand et al. 2004, 2005, 2006; Levshakov et al. 2006; Molaro et al. 2013). The early results have been criticized by Murphy et al. (2008a,b) who claim that their quoted significance is too high though not, in the case of the Chand et al. result, consistent with evidence for varying α (Srianand et al. 2007; Murphy et al. 2008a). Investigations of the change in α by comparing redshifted radio lines also do not show evidence of time variation (e.g. Cowie & Songaila 1995; Carilli et al. 2000; Kanekar et al. 2010, 2012; Levshakov et al. 2012). These results provide an alterna-

1 Based in part on data obtained at the W. M. Keck Observatory, which is jointly operated by the California Institute of Technology, the University of California, and the National Aeronautics and Space Administration.

tive source of evidence for a non-varying α that has different systematic effects to the MM method, though the interpretation depends on assuming a low value for the change in μ ≡ m_e/m_p for which there is direct evidence at z < 0.9 (Kanekar 2011; Bagdonaite et al. 2013a,b). (See e.g. Rahmani et al. (2013) for a summary of results at higher redshift). The discrepancy in published results could be reconciled if systematic effects dominate the measurements, leading to underestimates of the errors. In the present paper we consider both systematic uncertainties in spectrograph wavelength calibration and also velocity offsets introduced by complex velocity structure in even apparently simple and weak narrow lines and analyze their effect on claimed variations in α.

The current observational situation regarding variation in α is far from clear. Terrestrial laboratory and geophysical measurements show no sign of any time variation on both long and short time scales. Laboratory measurements (e.g. Uzan 2003) of the stability of atomic clocks are consistent with no instantaneous time variation at the present time, while analysis of the OKLO natural fission reactor places a limit of (−0.11 ≤ Δα/α ≤ 0.24) × 10^{−7} over a time span of 2 Gyr (Gould et al. 2006). Astronomical measurements, on the other hand, have so far given both null results and also the first reported detections of variation. A number of groups have looked for variation in α over cosmic time in quasar absorption lines at high redshift using various methodologies. All such measurements based on comparing the relative wavelength separation of the two

2 Variation of the Fine-Structure Constant

members of an alkaline doublet observed at high redshift in a quasar absorption system (Savedoff 1956) are consistent with no evolution (Potekhin & Varshalovich 1994; Cowie & Songaila 1995; Varshalovich et al. 1996; Murphy et al. 2001; Chand et al. 2005). It was only with the advent of the more sensitive MM method (Webb et al. 1999; Dzuba et al. 1999b,a) that a significant change at the level of Δα/α = (−0.57±0.11)×10^{−5} was claimed over the redshift range 0.2 < z < 4.2 (Murphy et al. 2004).

The enormous advantage of the MM method is its sensitivity: it is sensitive to α^{−1}Δα at a level of about 10^{−5} in an individual quasar absorption line system, making it about an order of magnitude better than the alkaline doublet method. On the other hand, this sensitivity is bought at the price of much greater required control of systematic effects, among the most important of which are the accuracy of the wavelength calibrations in the echelle spectrographs being used for the measurements, and the assumptions of uniform velocity structure in the various ion species being compared and uniform spatial abundance patterns (Bahcall et al. 2004; Uzan 2003; Lopez et al. 2002; Prochaska 2003; Rodríguez et al. 2006). The wavelength calibration is particularly critical since, in contrast to the alkaline doublet method, the lines being compared in the MM method can have wide wavelength separations. While these systematic effects have been extensively investigated and modeled (Murphy et al. 2003b, 2004), it is still likely that they do in fact dominate the measurement error and are responsible for the discrepancies in published results.

A suitable choice of ionic species can minimize or exclude some of the potential systematic errors associated with the MM method. In particular, concerns about systematics in the wavelength calibration can be reduced by using lines of singly ionised Cr and Zn to measure individual offsets since these lines are neighboring and interspersed with one another (Figure 1). Since the effect of a change in α is large and in the opposite sense for the two species (Dzuba et al. 2002), these two ions also provide an optimally sensitive measurement. For the neighboring Cr II 2026 Å and the Zn II 2026 Å lines, a change of Δα/α = 10^{−5} produces a relative offset of 0.48 km s^{−1} (Dzuba et al. 2002). This is large enough that with a simple sharp absorption line we can hope to measure the offset directly. A crucially important estimate of the magnitude of systematic errors in the MM method comes from having the required sensitivity and spectral resolution to fully analyze a single system at one redshift and map the velocity shifts from ion to ion (Levshakov et al. 2006). This is what we do here for two such systems, at z = 1.7382 in the quasar HS1946+7658 and at z = 1.6614 in the quasar HE1104−1805A.

However, suitable Cr and Zn systems are rare and most of the MM measurements have been made using Fe II and Mg II lines, which have two disadvantages. First, the offset between Fe II 2600 Å and 2342 Å and the Mg II 2800 Å doublet is smaller (0.21 km s^{−1} for Δα/α = 10^{−5}) than for the Cr and Zn lines; and second, these systems have a much wider wavelength separation. We shall show here that it is extremely hard using the HIRES spectrograph on the Keck I telescope to obtain the necessary wavelength accuracy for this type of measurement.

Fig. 1.— Segment of the spectrum of HE1104-1805A covering the Cr II and Zn II lines discussed in the text showing how close in wavelength these lines are. The spectrum is a 340-minute exposure obtained with the HIRES spectrograph on the Keck I 10m telescope using a 0.57^{′′} slit. The full spectrum covers the wavelength range from 4000 to 7800 Å with a resolution of 72,000 measured from the sky lines. The wavelength was calibrated with a 4th-order polynomial fit to a ThAr calibration lamp taken before and after the exposure and absolutely calibrated using night sky lines in the spectrum as discussed in the text. The final wavelengths are given as vacuum heliocentric. The signal-to-noise ratio is approximately 80 per resolution element in this wavelength region.

2. DATA AND DATA REDUCTION

For the present study we chose three quasars from our existing data base of high resolution quasar spectra (Songaila 2005) which appeared optimal for measuring the fine structure variation. These are HE1104- 1805A (z_{em} = 2.31), HS1700+6416 (z_{em} = 2.73), and HS1946+7658 (z_{em} = 3.02). These three quasars are very bright, allowing us to obtain high signal-to-noise observations even at very high spectral resolution (R = 72, 000) and their spectra all contain narrow, strong (but not saturated) Mg II lines with corresponding strong Fe II. In addition HE1104-1805A and HS1946+7658 contain damped Lyman α (DLA) absorbers with simple sharp and unsaturated metal lines that are ideal for measuring the fine structure variation with multiple lines and, in particular, ZnII and CrII. HE1104- 1805 is a gravitationally lensed system with multiple images (Wisotzki et al. 1993), of which the brightest (image “A”) is extremely luminous. The z = 1.6614 DLA absorber has intermediate strength Cr II and Zn II lines in its spectrum (N(CrII) ∼ 7 × 10^{12} cm^{−2} and N(ZnII) ∼ 2.4 × 10^{12} cm^{−2}; Figure 1). Furthermore, the dominant feature in the weaker singly-ionized absorption lines of the z = 1.6614 system is extremely sharp (b ∼ 4 km s^{−1}) and was only marginally resolved in our earlier moderately high resolution (R = 35, 000) observations. These earlier observations already suggested there was a velocity offset between the Cr II and Zn II lines in

SONGAILA & COWIE 3

TABLE 1 Log of Observations

Quasar z_{em} Date (UT) Exp. (s)

HE 1104−1805A 2.31 2005 Dec 27 3 × 2400 2009 Jan 31 1 × 2400 2005 Dec 27 2 × 2400 2008 Jan 3 2 × 2400 HS 1700+6416 2.73 2005 July 2 4 × 2400 2005 July 3 3 × 2400 HS 1946+7658 3.02 2004 Sep 10 6 × 2400 2005 July 3 2 × 2400 2006 Aug 29 3 × 2400 2005 July 2 2 × 2400 2006 Aug 30 2 × 2400

this system. HS1946+7658 also has an isolated narrow system corresponding to the DLA absorber at z = 1.7382 which is seen in the Cr II, Zn II and Mn II lines, though this system is weaker than that in HE1104-1805A and some useful lines lie in the Lyα forest.

The upgrade of the CCDs in HIRES spectrograph on the Keck I 10m telescope in 2004 provided finer pixel sampling and allowed the instrument to achieve proper sampling of the high spectral resolution that could be obtained with narrow slits. We therefore began an intensive observing program on these three quasars using a slit width of 0.574^{′′}, corresponding to a spectral resolution of R = 72, 000, in which we paid careful attention to the wavelength calibration. The seeing was generally larger than the slit width so the slit illumination should be uniform. We will discuss this in detail in §3. For each observation, 80– or 100–minute exposures were obtained in two 40– or 50–minute segments to allow for processing to remove cosmic rays. ThAr calibration lamps and in some case Iodine cell exposures of a white dwarf standard were taken before and after each pair of quasar exposures (i.e. every 80 minutes). The observations are summarized in Table 1. Each quasar was observed in multiple grating settings to provide complete wavelength coverage. This also allowed us to test how reproducible wavelengths were in different configurations of the instrument. The total exposure times are 340 minutes for HE1104-1805A, 280 minutes for HS1700+6416, and 600 minutes for HS1946+7658.

The observations were obtained with a 2-point binning in the spatial direction (corresponding to a binned pixel size of 0.24^{′′}) and no binning in the spectral direction. Each spectrum was extracted by order using an IDL procedure written for the purpose. The images were initially flattened using normalized exposures of a quartz flat lamp observed in the same spectrograph configuration. In each order the spatial distortion of the spectrum was measured from white dwarf calibration stars taken in the same configuration; these were also used to remove the blaze function of the instrument. Sky subtraction was performed by interpolating the sky measured on each side of the spectrum and a vector corresponding to the sky level at the position of the spectrum was stored for each order. Each spectrum was then extracted using a 5 binned spatial pixel window centered on the distorted spatial position at that wavelength to obtain the total counts at that position. Cosmic rays were rejected by comparing the spectra corresponding to the sub-exposures and a final summation of the spectra and the corresponding sky was then made and stored. The ThAr calibration spectra were measured over the same positions used to extract the spectra and also stored by order. The raw counts in the spectrum plus sky were used to compute the expected noise at each pixel assuming a read noise of 6 electrons per pixel and a gain setting of 2.4. The final spectral resolution was measured from the sky lines and is consistent with the nominal value of R = 72, 000. We show a Gaussian fit to a sample sky line at 6241 Å in Figure 2. The full width half maximum corresponds to 3.2 spectral pixels, giving a reasonable sampling. In the following analysis we use the laboratory wavelengths of relevant ions summarized in Murphy & Berengut (2014).

Fig. 2.— Fit to a sky line at 6241.6876 Å. (This is actually a double but the lines are close enough to be indistinguishable). The blue line is the fit to the sky, which is shown by the black squares. The red line marks the wavelength of the sky line. The wavelength scale is in the air system and corresponds to the average of the ThAr calibrations before and after the observation.

3. WAVELENGTH CALIBRATION

The accuracy of the wavelength calibration is a crucial constraint in achieving the sensitivity necessary to measure evolution in the fundamental constants, particularly if widely separated lines such as Mg II and Fe II are being used, and requires the adoption of very careful observing techniques and attention to systematics. This has previously been discussed for the HIRES spectrograph by Griest et al. (2010), who used iodine cell exposures to evaluate the systematics of ThAr lamp calibration techniques, and Thompson et al. (2009), who presented a calibration procedure for the VLT/UVES spectrograph that removes systematics previously noted in the pipeline procedure by Murphy et al. (2007). To obtain the wavelength calibration, we made ThAr lamp exposures before and after each object exposure, and also took a number of exposures each night of white dwarf standards with the iodine cell in place. Since Griest et al. have made a thorough study of the iodine cell calibration, we will not discuss this issue any further here but concentrate on

4 Variation of the Fine-Structure Constant

Fig. 3.— Calibration drift as a function of time. In each panel we show the difference in wavelength between the ThAr lines measured before and after the object exposure. Each point shows the directly measured offset of a single ThAr line with the orders color coded by wavelength from longest wavelengths (red) through intermediate wavelengths (green) to the shortest wavelengths (blue). The drift in offset continues smoothly as a function of time (in the first three panels the text shows the time of the second ThAr exposure) resulting in a large offset for the full period of the observations (bottom panel). The offset is differential with wavelength (see Figure 4) and also shows a gradient along each order.

how well the calibration can be made using only ThAr lines. It should be noted that many of the archival observations used in previous analyses of the variation in the fine-structure constant did not aim for precision calibration. The present discussion relates to observations specifically designed to obtain the most accurate calibrations possible with the ThAr lamp. We first discuss the drift in wavelength calibration exhibited by the before and after ThAr lamp spectra, and then analyze the accuracy of the best possible ThAr calibrations using night sky lines that are present in the object spectra, and also using the multiple measurements of the various lines furnished by the independent observations, and comparing the velocities of doublets seen in the spectra.

Fig. 4.— The average wavelength displacement in each order as a function of the central wavelength of the order. Black squares show data for HS 1946+7658, red for HE 1104−1805A and blue for HS 1700+6416.

3.1. ThAr lamp

A preliminary wavelength calibration was made using the ThAr calibration lamp exposures made before and after each quasar exposure (i.e. with a typical 80 minute separation). In each order we fitted Gaussians to between 15 and 20 lines uniformly covering the wavelength range. We then used a fourth-order polynomial to obtain the wavelength fit. The typical dispersion in the ThAr lines relative to the wavelength solution is 0.0016Å.

In order to measure the drift in the calibration we measured the shifts in individual ThAr lines between the before and after calibrations. Examples of these measurements are shown in Figure 3. The most pronounced effect is an overall wavelength offset, up to 0.025Å at 6000Å over an 80-minute observing period in an extreme case though the more typical value is ∼ 0.005Å. In Figure 3 we show that the effect is smoothly increasing as a function of time for a sequence of exposures, suggesting that it is caused by a regular change in the optical path, possibly driven by changes in the environment of the instrument. These overall shifts have no effect on the measurement of Δα/α, which depends on the relative offset of line pairs. However, the shifts also result in differential offsets along the orders and in the cross-dispersed direction (Figure 3). The relative offset of the orders as a function of wavelength is shown in Figure 4 for all of our ThAr pairs.

SONGAILA & COWIE 5

Fig. 5.— Examples of night sky lines from the September 2004 observations of HS1946+7658. The spectrum (black squares) is shown in the observed air wavelength frame corresponding to the ThAr calibration taken just before the observation. The wavelengths of the two components of the sky line, split by Λ splitting, are shown with the red vertical marks. The blue curve shows a Gaussian fit to the lines computed with the full width of the lines fixed to the instrument resolution of R = 72, 000 and the offset between the lines fixed to the theoretical separation. The panels show examples of splittings ranging from marginally resolved to a case where the splitting is four times the resolution. The offsets of the sky lines from the true position are indicated in the text description in each panel.

6 Variation of the Fine-Structure Constant

Both negative and positive absolute offsets are seen and the corresponding gradient is linearly related to the absolute offsets as d(δλ)/dλ ∝ 1.5×10^{−6} δλ (6000Å). Typical end-to-end wavelength shifts are ∼ 0.0015Å along the orders though in the most extreme case the value rises to ∼ 0.0050Å.

Under most conditions these offsets will scatter equally to negative and positive values and contribute only to the systematic errors. However, depending on the cause of the drift and the observer procedure, they could result in systematic effects. For example, if the offset were driven by temperature changes, which are more often negative through the night, and if observers normally take ThAr exposures prior to the on-sky observation, then there could be a systematic shift in Δα. However we assume here that the offsets simply add to the error budget.

The actual errors will depend on the observing procedure but if we assume that the data are being calibrated with a ThAr exposure taken 80 minutes away from the observation (which may be fairly typical) then we can use the current data to estimate the systematic error. For a system at z = 1, the dispersion in the measured offset between Fe II 2344Å and Mg II 2800Å corresponds to an r.m.s. error of 4.5 × 10^{−6} in Δα/α for an individual measurement.

3.2. Sky lines

We can also use the night sky lines in the spectra of the quasars to test the accuracy of the final wavelength solution and to check if there are residual distortions in the solution arising from the different optical path followed by the ThAr calibration lamp versus sky objects illuminating the slit. Since we used a very narrow slit (in all cases narrower than the typical seeing) the slit was approximately uniformly illuminated, and the sky lines should provide a good calibration. For our ThAr wavelength scale we used the average of the wavelength solutions computed from the before and after ThAr wavelength fits, which should remove much of the drift discussed in the previous subsection.

We selected appropriate night sky lines from the list tabulated by Osterbrock et al. (1996) in the wavelength range 5500 – 7500 Å. To obtain sufficient accuracy, we recalculated the wavelengths of all lines from the term values in Abrams et al. (1994). We fitted Gaussians to all sky lines using the line-fitting program MP- FIT (Markwardt 2009). Examples of the Gaussian fits are shown as the blue solid lines in Figure 5, plotted over the spectrum (black squares and error bars), shown in the observed air wavelength frame corresponding to the ThAr calibration taken immediately before the object exposure. The OH sky lines are doublets owing to Λ-splitting. The theoretical wavelengths of the Λ-split components are shown by the red lines. We fitted Gaussians with the full width of the lines fixed to the measured instrument resolution of R = 72, 000 and the wavelength offset between the Λ - split components fixed to the theoretical separation. Figure 5 shows examples of sky lines with Λ-splitting ranging from just resolved to about four times the instrumental resolution. The offsets of the ThAr-measured wavelengths of the sky lines from the true position range from 10^{−3} Å to 7 × 10^{−3} Å. These offsets are significantly larger than the statistical errors expected in the fits, which are typically in the range 5 × 10^{−4} – 10^{−3}Å.

Fig. 6.— Black squares: Offsets of the stronger sky lines in the individual spectra from the wavelength position expected from the sky-corrected ThAr calibration averaged over calibrations taken before and after observations. Only lines with Λ-splitting more than the instrumental resolution (R = 72, 000) are included. Where more than four obervations exist for a given skyline we also show the average with the larger red triangle. The blue diamonds show the offsets averaged in 500Å bins. The black curve shows a linear fit to all of the data points.

Fig. 7.— Comparison of the individual exposures of the Mn II 2594.4976Å line with the optimally weighted average of all the spectra corresponding to a 10 hour exposure, which is shown by the black solid line. We have plotted the optical depth versus the vacuum heliocenteric velocity for a redshift of 1.7382. The individual exposures are shown without smoothing or interpolation and each symbol shows an individual pixel. The purple circles show the data from the September 2004 configuration (4 hours), the black squares the data from July 2005 in the left configuration (80 minutes), the red diamonds the left configuration from August 2006 (2 hours), the blue upward pointing triangles the right configuration from July 2005 (80 minutes) and the green downward pointing triangles the right configuration from August 2006 (80 minutes).

We selected sky lines from this list with intensity > 50 counts whose Λ-split components are resolved at our instrumental resolution and have roughly equal intensities.

SONGAILA & COWIE 7

We rejected lines whose FWHM from the Gaussian fit appeared to be too narrow, indicating that the line might be spurious. This selection provided 20 – 30 sky lines in each spectrum.

Figure 6 shows the measured offsets in km s^{−1} for these sky lines in all the spectra as a function of wavelength. The offset is measured from the wavelength position expected from the final wavelength solution, as described above. The black squares with error bars show the individual offsets, the red triangles the average offset in cases with four or more observations of a given sky line, and the blue diamonds show the offsets averaged in 500 Å bins. The solid line is a linear fit to all the points. Over the range 5500 – 7500Å, where there are large numbers of sky lines, we find that there is a significant gradient, with d(Δv)/dλ = (−2.91 ± 0.66) × 10^{−5} km s^{−1}Å^{−1}. At z = 1.5, using Fe II 2344Å and Mg II 2800Å, this would result in an offset in the Δα/α measurement of −1.7 × 10^{−6}, a significant correction to measured offsets. Therefore a measurement of Δα/α with HIRES using Fe II and Mg II lines and ThAr calibration will show a negative bias. Griest et al. (2010) have also found large systematic errors in the HIRES wavelength calibration between 5000 Å and 6000 Å, using the Iodine cell to track wavelength shifts, and Whitmore et al. (2010), using similar methods, report similar though smaller systematics for the VLT/UVES spectrograph. By comparing solar and asteroid spectra, Rahmani et al. (2013) found wavelength-dependent offsets for UVES, though with the opposite slope to our result for HIRES.

In what follows we used the average ThAr line measurement for the wavelength solution. In Section 5 we then apply the correction to the wavelength solution based on the sky line fits to correct the measured results so that we can see the comparative size of the effect. The wavelengths were then converted to vacuum heliocentric which is used, except where specified otherwise, in the subsequent text.

3.3. Testing the measurement errors

Error estimation for both Voigt fitting and crosscorrelation is complex and there is considerable room for systematic effects. It is our assessment that many of the previous analyses have assigned surprisingly, and possibly unrealistically, small errors to their results. We estimated errors on our fitting in three ways. In the first we measured independent observations of the lines to compare the dispersion with the formal statistical error. In the second, we measured the scatter in an individual order using measurements of doublets in the spectra. In the third we placed the fitted model for a given line at a large number of neighboring random positions in the spectrum and then profile-fitted these simulated lines.

The formal statistical error will not include systematics, such as relative errors in the wavelength determination, uncertainties in the absorption line template, and so on. We therefore refitted the lines, separating the data by night of observation, and also separating systems that appeared in more than one order of the echelle spectrum. A comparison of the individual observations for a Mn II absorption line in HS1946+7658 with the final combined profile is shown in Figure 7. Up to eight independent measurements of the offsets were obtained in this way

Fig. 8.— Statistical and systematic errors from individual measurements of the z = 1.7382 system in HS 1946+7658. The velocity shift from lines of Fe II 2600 (red diamonds), Fe II 2382 (blue triangles), Mg I (green triangles), and Mg II (black squares) are shown for each available measurement. The error bars are 1σ statistical errors.

for some of the absorption lines, and these can be used to make an independent error estimate which should include nearly all of the these random systematic effects associated with the wavelength calibration and profile fitting (though not systematic effects that are present in all the observations such as the linear offset from the ThAr line calibration noted in the previous section).

In Figure 8 we show an example of the measured velocity offsets in a single system relative to the value measured in the combined spectrum. We show the Mg II doublet (black squares) and the Fe II 2344, 2382 and 2600 lines as colored symbols. For the weaker Fe II lines, with their higher statistical errors, the measured dispersion is fully consistent with the statistical error. However for the strong Mg II lines the statistical error is small and is dominated by the systematic error which is approximately 0.1 km s^{−1} in each individual measurement. This has little effect on any of the measurements discussed in the next sections since the differential errors are always dominated by weaker lines.

Griest et al.’s Iodine cell observations suggest that much of the velocity uncertainty of the Th Ar calibration arises in individual orders (the sawtooth pattern seen in their Figure 4). This is of considerable interest for methods such as the comparison of Cr and Zn lines discussed in section 4. We therefore tested this by measuring the doublet separations of C IV, Si IV, Mg II and Cr II lines in our data. We used only lines where both members of the doublet were in a single order, where lines appeared to be a single symmetric component, and where both members of the doublet were strong but unsaturated. We show the measured offsets as a function of the wavelength separation of the doublet at the observed redshift in Figure 9. The highest S/N measurements again show a larger scatter than would be expected based on statistical errors, with a typical maximum error of ∼ 0.3 km s^{−1}, consistent with the value expected from the Griest et al. result. This error is expected to be random and should average out with a large enough number of mea-

8 Variation of the Fine-Structure Constant

surements. The systematic error contributes a dispersion of about 0.17 km s^{−1} in addition to the statistical error, which is large enough to substantially increase the error estimates.

Fig. 9.— Velocity offset in the doublet separation of C IV (red diamonds), Mg II (blue triangles), Cr II (black squares) and Si IV (green triangle) doublets as a function of redshifted doublet separation.

Fig. 10.— An expanded region around the Cr II 2062.236 and the Zn II 2062.660 lines showing the structure of the absorption system at z = 1.6614 in HE 1104−1805A. The normalized continuum is shown by the dashed line and the instrument profile by the dotted line. The feature of primary interest is the sharp line at the marked wavelength measured from the Cr II line. This lies at the blue edge of the absorption structure and is just resolved at this resolution. There is weaker broad absorption to the red of this feature. The Zn II line is cleanly separated from the neighboring Cr II absorption and also from the very weak Mg I 2026 absorption which lies redward of it. We have also not identified any contamination of our lines by absorption features arising from other systems, though in any individual line measurement this remains as a concern.

The simulation technique, which was also used by Chand et al. (2004), has the advantage of automatically including the effects of continuum fitting and line contamination in the spectrum as well as the effects of non-Gaussian noise, and is therefore considerably superior in these respects to estimates that rely on only the local statistical noise to estimate the error. We expect a priori that this method will produce a larger estimate of the noise because of these effects. It also allows us to quantify the fraction of times a line will suffer a major error because of contamination by another absorption line feature or other structures in the the spectrum. We find that this type of analysis gives an average increase in the noise by a factor of 1.17 over the formal statistical errors, with a range from 0.9 – 1.3. This is slightly smaller than the factor of 1.5 seen by Agafonova et al. (2011). Most contamination by other lines is easily recognized and would be excluded in the actual measurements, but significant velocity offsets (> 4σ) which would not be easily recognized are seen in about 1% of the simulated lines.

4. CR II, ZN II AND MN II MEASUREMENTS

As we have discussed above, measurements based on the Cr II, Zn II and Mn II lines can avoid some of the wavelength calibration problems though they are still subject to the in-order errors. However, as we discuss here, variability in relative abundances in the substructure of the line can cause serious problems in analyzing even apparently weak and simple systems. A portion of the spectrum of HE1104-1805A covering the Zn II and Cr II lines of interest in an absorption system at z = 1.6614 is shown in Figure 1 and an expanded region around the Cr II 2062.236 and Zn II 2062.660 lines is shown in Figure 10. The expanded spectrum demonstrates that the wavelength structure of this absorption is indeed very simple in the weaker singly-ionized lines and consists of a single sharp feature which is only marginally resolved, together with very weak broader absorption to the red, which extends only to about 50 km s^{−1} and is nearly fully separated from the sharp feature. It is the sharp singly-ionized line which we focus on here. The velocity offset between the Cr II and Zn II lines can already be seen by visual inspection of Figure 10.

We first fitted Voigt profiles to all of the useful singlyionized lines that were not saturated. We used our own customized IDL routines, based on the MPFIT programs of Markwardt (2009). (We note that a crosscorrelation analysis gives basically identical results). A two-component fit based on the strong Si II 1808 line was used. The principal component, containing the bulk of the material, is the narrow feature with a b-value of 4.1 km s^{−1}; a single broad component was used to model the weaker red wing. We fitted each of the lines by holding the b-values fixed but allowing the column densities of all the components, and the overall velocity, to vary. The redshifts of the sharp component were measured and the corresponding velocity offsets determined. The offsets are not sensitive at any significant level to the choice of cloud model, and the results are almost unchanged if we allow the column density, velocity and b-value to vary independently in the two components. We note that the velocities are consistent between independent measurements of a given ion, suggesting that line contamination and line saturation are not problems.

We show the relation between the offset expected from a change in α and the measured velocity offset for the z = 1.6614 system in HE1104-1805A in Figure 11a. A linear regression analysis gives (0.74 ± 0.20) × 10^{−5} (statistical

SONGAILA & COWIE 9

Fig. 11a.— The measured velocity offsets from Voigt profile analysis in the various absorption lines in the z = 1.6614 system of HE1104-1805A are plotted against the offset which would be generated by a change in α of 10^{−5}. The symbols show the measured values with 1 σ errors (statistical only). The filled diamonds are the Zn II 2026 and 2062 lines, the filled square the Si II 1808 line, the open upward triangles the Ni II 1709, 1741 and 1751 lines, the open diamonds the Cr II 2056, 2062 and 2066 lines, the downward triangle the Fe II 1611 line and the open squares the Mn II 2576 and 2594 lines. The solid line shows the optimal linear fit to all of the lines, which corresponds to a Δα/α of (0.74 ± 0.20) × 10^{−5} (statistical error only). The dotted line shows the fit obtained by including only the Zn II and Cr II lines, giving Δα/α of (1.87±0.24)×10^{−5} . The dashed line shows the null result of Δα/α = (−0.43 ± 0.24) × 10^{−5}, obtained by including only the Mn II, Ni II and Cr II lines. Wavelengths are from the compilation of Murphy & Berengut (2014). The unit shift is the displacement in velocity which would be produced by a Δα/α = 10^{−5} from Dzuba et al. (2002) and Berengut et al. (2004).

error only) for the required Δα/α. The best fit is shown by the solid line in the figure. However, the fit has a very poor χ^2 because of the offset between the Mn II and Zn II lines. We have also measured the offset which would be obtained from restricted subsets of the lines. If we include only the Zn II and Cr II lines we obtain (1.87 ± 0.24) × 10^{−5}, whereas if we use the Mn II, Ni II and Cr II lines this reduces to a null result of (−0.43 ± 0.24) × 10^{−5}. Including the systematic errors discussed in Griest et al. (2010) and Section 3.3 would significantly increase the errors from 0.24 × 10^{−5} to 0.46 × 10^{−5} but still leave a highly significant difference between the fits based on the Zn II and Mn II lines.

This result shows that there can be serious systematic problems in determining Δα using measurements of just Cr II and Zn II. It strongly suggests that, even in a very simple narrow system like the present one, abundance variation in substructure in the sharp feature (the most likely systematic) can produce an apparent offset between the species. Zn and Cr are well known to have very different abundance patterns, an effect which has traditionally been ascribed to dust depletion but may also reflect variations in nucleosynthesis (Pettini 2001; Prochaska 2003). If a positive subcomponent of the narrow absorption line had a high Cr/Zn ratio relative to a negative subcomponent this could pull the relative offsets of Zn II and Cr II to negative values. This is consistent with the observed velocity pattern: the weakly refractory

Zn II and Si II have the most negative velocities, shown by the filled symbols in Figure 11a, while the refractory elements (Ni II, Mn II, Cr II and Fe II) have more consistent positive velocities. It appears that using Mn II with Cr II is more secure than using Zn II with Cr II since both Mn II and Cr II are refractory elements.

Changes in the isotopic mix are unlikely to produce significant changes in the results. The isotopic effect may be largest in the Zn II lines but even here the maximum shift which could be obtained by changing the isotope mix from the local uniform mix of isotopes to being predominantly^{64}Zn is only about 0.1 km s^{−1}, which is small compared with the measured shifts. As long as^{52}Cr remains the dominant isotope we expect the Cr II lines to have relatively small isotopic shifts (Murphy & Berengut 2014).

The z = 1.7382 system has a very similar structure and we adopted the same fitting procedure. The measured offsets shown in Figure 11b yield a consistent solution for both Zn II and Mn II relative to Cr II, albeit with larger errors for this weaker system. The regression analysis gives Δα/α = (−0.94 ± 0.24) × 10^{−5} with an acceptable χ^2, and consistent results between Zn II and Cr II and Mn II and Cr II. Again, including the systematic error from Section 3.3 raises the error from 0.24 × 10^{−5} to 0.59 × 10^{−5}. Adopting the values based on Mn II, Ni II and Cr II ions and correcting for the systematic errors, we consider that the most reliable measurements are Δα/α = (−0.47 ± 0.53) × 10^{−5} for the z = 1.6614 system in HE1104−1805A and Δα/α = (−0.79 ± 0.62) × 10^{−5} for the z = 1.7382 system in HS1946+7658. However, systematic errors remain a concern even when using the more consistent ions and in particular abundance variations may cause velocity shifts. Large numbers of systems would be required to average out the latter effect.

Fig. 11b.— As in (a) for the z = 1.7382 system in HS1946+7658. Here the fit to all the measured lines gives Δα/α = (−0.94 ± 0.24) × 10^{−5} (solid line), while fitting only Zn II and Cr II gives Δα/α = (−0.24±0.69)×10^{−5} (dotted line), and fitting only Mn II and Cr II gives Δα/α = (−0.96 ± 0.32) × 10^{−5} (dashed line).

5. MG II MEASUREMENTS

10 Variation of the Fine-Structure Constant

Fig. 12a.— Optical depth of Fe II 2600 (red), Fe II 2382 (blue) and the Mg II doublet (black) for the four Fe II - Mg II systems that show no evidence of saturation in the Mg II doublet. The black dashed line shows the Mg II 2796 optical depth divided by a factor of two. (Note that the vertical scale is enhanced in one of the panels for clarity).

Fig. 12b.— As in (a) for the four Fe II - Mg II systems that show some evidence of saturation in the Mg II doublet.

We next analysed the eight narrow Mg II absorption systems seen in the three quasars. These are drawn from five independent complexes, two of which contain two

SONGAILA & COWIE 11

or three useful isolated narrow features. The Fe II and Mg II lines in each of the systems are shown in Figure 12. In all cases the lines are separated from neighboring absorption features and at least some of the Fe II lines are strong enough for accurate measurements. The Mg II doublet ratio can be used to estimate the degree of saturation, and there are four systems in which the Mg II lines appear unsaturated and four in which at least the Mg II lines show saturation effects. We profile-fitted each of the lines using a model based on the Mg II 2803 line and varying only the individual column densities of the components and the overall velocity of the system. The results are shown in Figure 13.

Fig. 13.— Measured Δα/α based on the offsets of the Fe lines from the Mg II 2803 line are shown versus redshift. Fe II 2600 measurements are shown with black diamonds, Fe II 2344 with blue triangles, and Fe II 2382 with red squares. The bars show the 1 σ statistical errors. The Fe II 2344 and Fe II 2382 lines are slightly displaced in redshift for clarity. The weighted mean value is Δα/α = (0.10 ± 0.24) × 10^{−5}.

Figure 13 shows that the spread of these systems, which range in redshift from z = 0.7 to z = 1.5, is consistent with the assigned errors. Including only statistical errors, the error-weighted Δα/α is (0.10 ± 0.24) × 10^{−5}. When we correct for the wavelength bias discussed in Section 3.2 and for the systematic errors discussed in Section 3.3 this becomes Δα/α = (0.43 ± 0.34) × 10^{−5}. The small offsets for Mg II relative to Fe II also show that change in the isotopic mix of Mg II from the local value is not large in these systems and is not weighted toward the heavier isotopes. However, the effects of the isotopic mix in some of the quasar absorption lines can be large (Agafonova et al. 2011) and could contribute to the spread seen here.

6. SUMMARY

MM measurements of the evolution of the fine structure constant are generally based on either comparison of Mg II and Fe II lines or (at higher redshifts) on measurements of Cr II, Zn II, Ni II and Mn II lines. Both have significant problems which have to be dealt with in order to obtain an accurate limit.

In the case of the widely separated Mg II and Fe II lines, extreme care must be taken in the wavelength calibration. As has previously been discussed in Griest et al. (2010), we see drift in the HIRES wavelength calibration with time together with a significant systematic error in the ThAr calibration of each order of the spectrum and, using the sky lines as a calibrator, a significant linear deviation between the sky line based calibration and the ThAr line calibration. The latter effect will produce a negative deviation in the measurement of Δα/α for HIRES observations. The exact shift depends on the redshift and line pair used but is around 1.7 × 10^{−6} for typical observations and would reduce the significance of the Murphy et al. (2003a) evolution from 5σ to about 3.5σ, assuming that the sky offset on HIRES remains at a fixed level over the course of time and has not changed between the observations of Murphy et al. (2003a) and those presented here. Similar effects have been noted for the UVES spectrograph on the VLT (Griest et al. 2010; Whitmore et al. 2010; Rahmani et al. 2013; Bonifacio et al. 2014). In particular, Rahmani et al. (2013) found wavelength-dependent offsets of a similar magnitude to those discussed here for HIRES by comparing solar and asteroid spectra in the wavelength range 3300Å– 3900Å. However, these offsets vary with wavelength in the opposite sense to the slope we find for HIRES, and so will produce a positive deviation. If a consistent negative slope is found in further tests of the HIRES wavelength accuracy, the opposite signs of the HIRES and UVES observations could provide a natural explanation of the apparent spatial variation in α claimed by King et al. (2012).

We have measured the variation using our present high S/N and high resolution observations of eight systems in Mg II and Fe II, obtaining a value of Δα/α = (0.43 ± 0.34) × 10^{−5} when we correct for the systematic bias and allow for systematic errors in the line fitting. This null result is consistent with most previous measurements using a variety of techniques.

Measurements based on the neighboring lines of Cr II, Zn II etc. occur in higher column density systems where abundance variation in unresolved subcomponents can cause measurement errors. In the present work we have argued that Mn II, Ni II and Cr II may give the most robust results for Δα/α and that Zn II and Cr II measurements should be avoided. Using the Mn II and Cr II measurements for two weak and narrow systems we found limits of (−0.47 ± 0.53) × 10^{−5} and (−0.79 ± 0.62) × 10^{−5} for Δα/α when we allow for systematic wavelength calibration errors.

Combining the Mg II and Fe II results with the Cr II and Mn II results gives us a final null result of Δα/α = (0.01±0.26)×10^{−5}. We conclude that spectrosopic measurements, made using these methods, are not yet capable of unambiguously detecting variation in α.

We gratefully acknowledge support of this work through the National Science Foundation. We would like to thank Amy Barger for drawing our attention to work on the spatial variation of the fine structure constant and to acknowledge Maria Pereira’s early contributions to our cross correlation analysis of the quasar absorption lines. We would also like to thank the anonymous referee and Michael Murphy, John Webb, and Sergei Levshakov for comments on the first draft of the paper.

12 Variation of the Fine-Structure Constant

REFERENCES

Abrams, M. C., Davis, S. P., Rao, M. L. P., Engleman, Jr., R., & Brault, J. W. 1994, ApJS, 93, 351 Agafonova, I. I., Molaro, P., Levshakov, S. A., & Hou, J. L. 2011, A&A, 529, A28 Bagdonaite, J., Daprà, M., Jansen, P., Bethlem, H. L., Ubachs, W., Muller, S., Henkel, C., & Menten, K. M. 2013a, Physical Review Letters, 111, 231101 Bagdonaite, J., Jansen, P., Henkel, C., Bethlem, H. L., Menten, K. M., & Ubachs, W. 2013b, Science, 339, 46 Bahcall, J. N., Steinhardt, C. L., & Schlegel, D. 2004, ApJ, 600, 520 Berengut, J. C., Dzuba, V. A., Flambaum, V. V., & Marchenko, M. V. 2004, Phys. Rev. A, 70, 064101 Bonifacio, P., Rahmani, H., Whitmore, J. B., Wendt, M., Centurion, M., Molaro, P., Srianand, R., Murphy, M. T., et al. 2014, Astronomische Nachrichten, 335, 83 Carilli, C. L., Menten, K. M., Stocke, J. T., Perlman, E., Vermeulen, R., Briggs, F., de Bruyn, A. G., Conway, J., & Moore, C. P. 2000, Physical Review Letters, 85, 5511 Chand, H., Petitjean, P., Srianand, R., & Aracil, B. 2005, A&A, 430, 47 Chand, H., Srianand, R., Petitjean, P., & Aracil, B. 2004, A&A, 417, 853 Chand, H., Srianand, R., Petitjean, P., Aracil, B., Quast, R., & Reimers, D. 2006, A&A, 451, 45 Cowie, L. L. & Songaila, A. 1995, ApJ, 453, 596 Dzuba, V. A., Flambaum, V. V., Kozlov, M. G., & Marchenko, M. 2002, Phys. Rev. A, 66, 022501 Dzuba, V. A., Flambaum, V. V., & Webb, J. K. 1999a, Phys. Rev. A, 59, 230 —. 1999b, Physical Review Letters, 82, 888 Gould, C. R., Sharapov, E. I., & Lamoreaux, S. K. 2006, Phys. Rev. C, 74, 024607 Griest, K., Whitmore, J. B., Wolfe, A. M., Prochaska, J. X., Howk, J. C., & Marcy, G. W. 2010, ApJ, 708, 158 Kanekar, N. 2011, ApJ, 728, L12 Kanekar, N., Langston, G. I., Stocke, J. T., Carilli, C. L., & Menten, K. M. 2012, ApJ, 746, L16 Kanekar, N., Prochaska, J. X., Ellison, S. L., & Chengalur, J. N.

2010, ApJ, 712, L148 King, J. A., Webb, J. K., Murphy, M. T., Flambaum, V. V., Carswell, R. F., Bainbridge, M. B., Wilczynska, M. R., & Koch, F. E. 2012, MNRAS, 422, 3370 Levshakov, S. A., Centurión, M., Molaro, P., D’Odorico, S., Reimers, D., Quast, R., & Pollmann, M. 2006, A&A, 449, 879 Levshakov, S. A., Combes, F., Boone, F., Agafonova, I. I., Reimers, D., & Kozlov, M. G. 2012, A&A, 540, L9 Lopez, S., Reimers, D., D’Odorico, S., & Prochaska, J. X. 2002, A&A, 385, 778 Markwardt, C. B. 2009, in Astronomical Society of the Pacific Conference Series, Vol. 411, Astronomical Data Analysis Software and Systems XVIII, ed. D. A. Bohlender, D. Durand, & P. Dowler, 251

Molaro, P., Centurión, M., Whitmore, J. B., Evans, T. M., Murphy, M. T., Agafonova, I. I., Bonifacio, P., D’Odorico, S., et al. 2013, A&A, 555, A68 Murphy, M. T. & Berengut, J. C. 2014, MNRAS, 438, 388 Murphy, M. T., Flambaum, V. V., Webb, J. K., Dzuba, V. A., Prochaska, J. X., & Wolfe, A. M. 2004, in Lecture Notes in Physics, Berlin Springer Verlag, Vol. 648, Astrophysics, Clocks and Fundamental Constants, ed. S. G. Karshenboim & E. Peik, 131–150 Murphy, M. T., Tzanavaris, P., Webb, J. K., & Lovis, C. 2007, MNRAS, 378, 221 Murphy, M. T., Webb, J. K., & Flambaum, V. V. 2003a, MNRAS, 345, 609 —. 2008a, MNRAS, 384, 1053 Murphy, M. T., Webb, J. K., & Flambaum, V. V. 2008b, in Precision Spectroscopy in Astrophysics, ed. N. C. Santos, L. Pasquini, A. C. M. Correia, & M. Romaniello, 95–99 Murphy, M. T., Webb, J. K., Flambaum, V. V., & Curran, S. J.

2003b, Ap&SS, 283, 577 Murphy, M. T., Webb, J. K., Flambaum, V. V., Prochaska, J. X., & Wolfe, A. M. 2001, MNRAS, 327, 1237 Osterbrock, D. E., Fulbright, J. P., Martel, A. R., Keane, M. J., Trager, S. C., & Basri, G. 1996, PASP, 108, 277 Pettini, M. 2001, in ESA Special Publication, Vol. 460, The Promise of the Herschel Space Observatory, ed. G. L. Pilbratt, J. Cernicharo, A. M. Heras, T. Prusti, & R. Harris, 113 Potekhin, A. Y. & Varshalovich, D. A. 1994, A&AS, 104, 89 Prochaska, J. X. 2003, ApJ, 582, 49 Rahmani, H., Wendt, M., Srianand, R., Noterdaeme, P., Petitjean, P., Molaro, P., Whitmore, J. B., Murphy, M. T., et al. 2013, MNRAS, 435, 861

Rodríguez, E., Petitjean, P., Aracil, B., Ledoux, C., & Srianand, R. 2006, A&A, 446, 791 Savedoff, M. P. 1956, Nature, 178, 688 Songaila, A. 2005, AJ, 130, 1996 Srianand, R., Chand, H., Petitjean, P., & Aracil, B. 2004, Physical Review Letters, 92, 121302 —. 2007, Physical Review Letters, 99, 239002 Thompson, R. I., Bechtold, J., Black, J. H., & Martins, C. J. A. P. 2009, New A, 14, 379 Uzan, J.-P. 2003, Reviews of Modern Physics, 75, 403 Varshalovich, D. A., Panchuk, V. E., & Ivanchik, A. V. 1996, Astronomy Letters, 22, 6 Webb, J. K., Flambaum, V. V., Churchill, C. W., Drinkwater, M. J., & Barrow, J. D. 1999, Physical Review Letters, 82, 884 Webb, J. K., King, J. A., Murphy, M. T., Flambaum, V. V., Carswell, R. F., & Bainbridge, M. B. 2011, Physical Review Letters, 107, 191101 Webb, J. K., Murphy, M. T., Flambaum, V. V., & Curran, S. J.

2003, Ap&SS, 283, 565 Webb, J. K., Wright, A., Koch, F. E., & Murphy, M. T. 2014, Mem. Soc. Astron. Italiana, 85, 57 Whitmore, J. B., Murphy, M. T., & Griest, K. 2010, ApJ, 723, 89 Wisotzki, L., Koehler, T., Kayser, R., & Reimers, D. 1993, A&A, 278, L15