arXiv:1401.1788v3 [cond-mat.str-el] 14 Mar 2014

Phonon Density of States and Anharmonicity of UO_2

Judy W.L. Pang,^{1, ∗} Aleksandr Chernatynskiy,^2 Bennett C. Larson,^1 William J.L. Buyers,^3 Douglas L. Abernathy,^4 Kenneth J. McClellan,^5 and Simon R. Phillpot^2 1Oak Ridge National Laboratory, Materials Science and Technology Division, Oak Ridge, Tennessee 37831, USA 2Department of Materials Science and Engineering, University of Florida, Gainesville, Florida 32611, USA 3Chalk River Laboratories, National Research Council, Chalk River, ON, K0J 1J0 Canada 4Oak Ridge National Laboratory, Quantum Condensed Matter Division, Oak Ridge, Tennessee 37831, USA 5Los Alamos National Laboratory, Materials Science and Technology Division, Los Alamos, New Mexico 87545, USA (Dated: July 17, 2018)

Phonon density of states (PDOS) measurements have been performed on polycrystalline UO2 at 295 and 1200 K using time-of-flight inelastic neutron scattering to investigate the impact of anharmonicity on the vibrational spectra and to benchmark ab initio PDOS simulations performed on this strongly correlated Mott-insulator. Time-of-flight PDOS measurements include anharmonic linewidth broadening inherently and the factor of ∼ 7 enhancement of the oxygen spectrum relative to the uranium component by the neutron weighting increases sensitivity to the oxygendominated optical phonon modes. The first-principles simulations of quasi-harmonic PDOS spectra were neutron-weighted and anharmonicity was introduced in an approximate way by convolution with wavevector-weighted averages over our previously measured phonon linewidths for UO2 that are provided in numerical form. Comparisons between the PDOS measurements and the simulations show reasonable agreement overall, but they also reveal important areas of disagreement for both high and low temperatures. The discrepancies stem largely from an ∼ 10 meV compression in the overall bandwidth (energy range) of the oxygen-dominated optical phonons in the simulations. A similar linewidth-convoluted comparison performed with the PDOS spectrum of Dolling et al. obtained by shell-model fitting to their historical phonon dispersion measurements shows excellent agreement with the time-of-flight PDOS measurements reported here. In contrast, we show by comparisons of spectra in linewidth-convoluted form that recent first-principles simulations for UO2 fail to account for the PDOS spectrum determined from the measurements of Dolling et al. These results demonstrate PDOS measurements to be stringent tests for ab inito simulations of phonon physics in UO2 and they indicate further the need for advances in theory to address lattice dynamics of UO2.

PACS numbers: 71.27.+a, 78.70.Nx, 63.20.Ry, 63.20.dk, 65.40.-b

I. INTRODUCTION

The physical properties of UO_2 are of strong scientific interest — fundamentally as a highly correlated electronic system and technologically as the most widely used nuclear fuel. As a Mott-insulator, the technologically important thermal transport of UO_2 is controlled by phonon kinetics and anharmonicity, which are in turn sensitive functions of the strongly correlated electronic structure of UO_2.^{1,2} While recent first-principles simulations for UO_2^{3–5} have reported good agreement with experimental elastic constants, bulk moduli, and lattice heat capacity measurements, a reduced level of agreement was found for phonon dispersion and phonon density of states (PDOS) simulations compared to the experimental inelastic neutron scattering (INS) results of Dolling et al.^6 Moreover, Pang et al.^2 reported results similar to other ab initio phonon dispersion simulations,^{2–5} but differences of more than a factor of two between ab initio simulations and INS measurements of phonon linewidths (i.e. inverse lifetimes) for UO_2,^2 especially at high temperature (1200 K).

Since 3^{rd} order interatomic forces are required for simulations of phonon linewidths and thermal transport,^2 it might be anticipated that the large discrepancies in the linewidths are a result of the difficulty in calculating 3^{rd} order derivatives for the strongly correlated 5f electronic structure of UO_2. Counter-intuitively, however, the major source of the discrepancy in the phonon linewidth simulations was identified^2 to lie within the phonon energies and dispersion. This suggests that presently available ab initio simulations^{3–5} of the 2^{nd} order interatomic forces are not sufficiently accurate for handling anharmonicity and phonon linewidths, and hence, for simulations of thermal transport in UO_2. Considering the large anharmonicity of UO_2 and the limitations of the quasi-harmonic approximation to account for temperature effects as used in Ref. 2, other methods such as ab initio molecular dynamics^{7,8} that include anharmonicity rigorously should be considered as well.

The strong sensitivity of phonon linewidth simulations to the 2^{nd} order force derivatives and phonon dispersion has been discussed in the context of ab initio simulations of phonon lifetimes and thermal transport in non-highly correlated systems,^{9–12} in which it has been shown that highly accurate dispersion simulations can be performed. Since phonon linewidths have a collective inverse 4^{th} power dependence on phonon energies within 3-phonon scattering,^{12,13} it is important to make make quantitative experimental tests of the accuracy of phonon energies in the simulations for UO_2.^{2–5} These first-principles PDOS simulations have been compared with the shell model derived PDOS specturm of Dolling based on symmetry direction dispersion measurements for UO_2.^6 However, until now, neutron time-of-flight measurements of PDOS have not been available to provide full Brillouin zone tests of phonon zone boundary energies and phonon energy gradients,^7 as well as the impact of temperature and anharmonicity on the spectrum. In fact, the only measured PDOS spectrum reported for an actinide oxide was measured by inelastic x-ray scattering at room temperature in polycrystalline PuO_2^{14} because of the strong thermal neutron absorption of Pu.

To the extent that phonon dispersion accuracy comparable to that achieved for weakly correlated materials^{9–12} is required for phonon transport simulations, further extension of the DFT approach such as through hybrid functional density functional theory (HF-DFT),^{15–17} or through higher-level first-principles theories such as dynamical mean field theory (DMFT)^{1,18,19} may be needed for UO_2. Unfortunately, calculations of 3^{rd} order interatomic forces necessary for phonon linewidth simulations are likely to be computationally prohibitive for these techniques using the finite difference approach and will be technically very challenging for faithful implementation of the analytical derivatives of the total energy. Nevertheless, we emphasize that phonon dispersion has been found^2 to have a strong influence on the determination of phonon lifetimes in UO_2 so accuracy of phonon energies is critical. We note also that new numerical approaches are under development for finite temperature lattice dynamics from first principles.^{20}

Here we report time-of-flight INS PDOS measurements on UO_2 at 295 and 1200 K. We also report detailed comparisons of these measurements with ab initio PDOS simulations by introducing anharmonic broadening into the simulations through energy averages over our previously reported comprehensive set of experimental phonon linewidths for UO_2.^2 We further compare our phonon-linewidth-convoluted PDOS simulations with phonon linewidth broadened PDOS simulations in the literature^{3–5} and with the shell model derived PDOS spectrum of Dolling et al.^6 for UO_2. These comparisons show excellent agreement between our time-of flight measurements and the phonon-broadened shell model derived PDOS spectrum of Dolling, but demonstrate significant and systematic discrepancies between experimental PDOS measurements and presently available ab initio simulations.

II. EXPERIMENT

Neutron-weighted phonon density of states measurements were determined for UO_2 at 295 K and 1200 K through INS measurements on the ARCS time-of-fight spectrometer at the Spallation Neutron Source (SNS) at Oak Ridge National Laboratory.^{21} The samples of depleted UO_2 polycrystalline material were sintered to 92 % of theoretical density at 1650^∘C under Ar followed by conditioning at temperature and cool down under Ar- 6% H_2 in order to achieve a nominal oxygen stoichiometry of 2.00. The measurements were performed on ∼ 5 mm diameter cylindrical samples with a total mass of 9.09 g encapsulated in a 5.5 mm diameter vanadium can mounted in a high temperature vacuum furnace. Measurements on the ARCS spectrometer with incident neutron energies, E_i, of 30, 60, and 120 meV provided energy resolutions (FWHM) of ∼ 0.9, 1.8, and 3.6 meV, respectively, as described in detail elsewhere.^{21} The backgrounds introduced by the sample containment can and the furnace were removed using measurements on a duplicate (but empty) vanadium can. The detector efficiency of the spectrometer was calibrated by measurements on reference vanadium powder.

The corrected spectra were normalized by the incident proton current of 4 Coulomb/hr and binned to obtain the scattered neutron counts I(E, ϕ) as a function of energy loss E and scattering angle ϕ. To obtain spectra within the incoherent scattering approximation, the scattered intensity spectra were converted to the scattering function S(E, Q) and integrated over momentum transfers Q ranging from 3 to 7 Å^{−1}, corresponding to about four Brillouin zones of UO_2 to obtain S(E), which was then converted to the neutron-weighted generalized PDOS g^{NW} (E).^{22} Because of the form factor, the impact of the magnetic moments of the U^{4+} ions is not significant for Q above 3 Å^{−1}. Corrections for multiphonon and multiple scatterings effects^{23,24} were made using the iterative method^{25} of Sears et al.^{26} In order to take advantage of the higher energy resolution of the energy loss spectra with lower incident neutron energies, the phonon energy spectrum was covered by concatenating measurements for E below 24 meV from the E_i = 30 meV spectrum, the density of states between E = 24 – 45 meV was obtained from the E_i = 60 meV spectrum, and the E_i = 120 meV spectrum was used to determine the intensities for E above 45 meV. Using the method as described in Ref. 24, the full range of the spectrum was determined by normalizing the total intensity of the E_i = 30 meV spectrum to the percentage of the density of states below 24 meV of the 60 meV spectrum, followed by the normalization of the total weight of the subsequent spectrum to the fraction of the density of states below 45 meV of the E_i = 120 meV spectrum.

For inelastic scattering averaged over this wide range (3 – 7 Å^{−1}) of |Q|,^{22,27} the neutron-weighted PDOS spectrum for polycrystalline UO_2 is given by: g^{NW} ∼= σ_U M_U g_U (E) + 2 σ_O M_O g_O(E), (1)

where g_U (E) and g_O(E) are the partial density of states for uranium and oxygen in UO_2, respectively, and M_i and σ_i are the atomic masses and neutron scattering cross-sections^{28} for the i = U and O atoms. Since

FIG. 1. Neutron-weighted phonon density of states g^{NW}(E ) of UO2 measured at 295 K and 1200 K.

σ_O M_O is about 7 times σ_U M_U , the neutron-weighted PDOS

spectra for UO_2 is inherently weighted heavily toward oxygen atom scattering. We note that the simple form of Eq. (1) is possible because the effect on the measured PDOS spectrum of the thermal Debye-Waller factors exp(−2W_i) for i = U, O is known to be negligible for low temperatures.^{22} And we have found that even at 1200 K the overall impact of the Debye-Waller factors (using the measured Debye-Waller factors by Willis^{29}) for UO_2 is under 2 %, which is within the experimental uncertainty of the measured PDOS spectra. All the presented PDOS spectra are normalized to unity.

III. RESULTS

A. Time-of-Flight PDOS Measurements at 295 K and 1200 K

Figure 1 shows experimental phonon density of states spectra for UO_2 measured at temperatures of 295 K and 1200 K. The 295 K spectrum has resolved peaks at (nominally) 12, 21, 33, 56, and 72 meV and a cutoff at 81 meV while the corresponding peaks at 1200 K were found to be at 11, 19, 30, 55, and 70 meV, with a cutoff at 81 meV. As illustrated in Fig. 2(a), these peaks correspond to zone boundary phonon energies identified in previously reported single crystal UO_2 measurements at 295 and 1200 K;^2 these data are plotted in Fig. 2(a) for completeness and for zone-boundary symmetry direction identification. The peak at 11 – 12 meV corresponds to transverse acoustic (TA) zone-boundary phonons at the X and L points and the weaker (and broader) peak at ∼ 20 meV corresponds to the longitudinal acoustic (LA) phonon zone boundary energies at the K and L points. The broad PDOS peak for 295 K and the marginally resolved peak for 1200 K at 33 meV correspond roughly to the TO1 transverse optical and LO1 longitudinal optical zone boundary energies at the X and K points. The peak at 56 meV stems from the TO2 transverse optical zone boundary energies at the X and K points and the 72 meV peak corresponds to the slowly dispersing LO2 longitudinal optical phonon zone boundary energies at the X, K, and L points. The relatively small (<2 meV) softening observable in both the two low-energy PDOS peaks and the two high-energy peaks in Fig. 1 and Fig. 2(b), i.e. as the temperature was changed from 295 to 1200 K, is consistent with the similarly small changes observed in the high symmetry direction single crystal dispersion measurements in Fig. 2(a).

The most noticeable temperature-induced phonon lifetime change in the PDOS lies in the intermediate energy range of 25 – 40 meV where the already broad, but wellresolved peak at 33 meV is broadened at 1200 K to an almost unresolved shoulder in the spectrum. This is in contrast to little or no observable change in the shape of the peaks at 56 and 72 meV where the ARCS spectrometer measurement resolution is the widest (∼ 3 meV).

B. First-Principles PDOS Simulations

To test our fundamental understanding of UO_2 using the above PDOS measurements, we show in Figs. 3a and 3b ab initio PDOS spectra simulations associated with the dispersion simulations in Fig. 2. These simulations were performed at 295 and 1200 K using the generalized gradient approximation (GGA + U ) density functional theory (DFT) and a Hubbard U correction described in Ref. 2. The effect of finite temperature on the phonon structure was taken into account via the quasi-harmonic approximation as described in Ref. 2. In this approach, the equilibrium phonon structure at a given temperature is determined by free energy minimization of both the potential energy and the temperature-dependent energy of the phonon subsystem. Phonon energies are volume-dependent, hence, inclusion of the phonon energy term implicitly accounts for the anharmonic thermal expansion effects on the phonon structure.^{30} UO_2 is paramagnetic with a fluorite cubic crystal structure above 30 K. In our simulations at 295 and 1200 K, the cubic crystal symmetry rather than the distorted ground state structure^{31} with the spin arrangement approximated to be the low temperature antiferromagnetic 1-k structure was applied. The first-principles calculations were performed using the VASP simulation package^{32} and the phonon calculations were performed using PhonTS software package.^{33} The TO-LO splitting at the zone center Γ in UO_2 was accounted for using the approach proposed by Wang et al.^{34} The effective Born charges of 5.31e for U^{4+} and -2.655e for O^{2-}, and dielectric constant of 5.2 needed in the simulations of the TO-LO splitting effect were determined from a separate linear response calculation. We note that the PDOS calculations as a function of energy in Fig. 3 were performed with 25 × 25 × 25 k-point resolution compared with the 13 × 13 × 13 resolution phonon dispersion simulations re-

FIG. 2. (a) Phonon dispersion curves of UO2 measured at 295 K (blue open symbols) and at 1200 K (red solid symbols). Circles (triangles) represent the transverse (longitudinal) phonons. Measurements at the zone boundary points X and L are highlighted with larger symbols. Dashed and solid lines are the simulations of phonon dispersion at 295 and 1200 K respectively, using GGA + U approximations. (b) Corresponding neutron-weighted phonon density of states g^{NW}(E ) of UO2 measurements at 295 K and 1200 K.

ported in Ref. 2, as a function of both wave vector and energy.

In order to compare the simulated PDOS spectra with the measured PDOS spectra, the PDOS simulations in Fig. 3 have been “neutron-weighted” according to Eq. (1) using the simulated partial density of states g_U (E) and g_O(E) shown in Fig. 4. The line plots in Fig. 4 indicate that uranium vibrations associated with acoustic phonons dominate the spectra for energies below 25 meV at 295 K and below 22 meV at 1200 K; while oxygen vibrations associated with optical phonons dominate (95 – 99 %) the PDOS spectra for energies from 25 up to 70 meV at 295 K and from 22 to 65 meV at 1200 K. This almost complete separation of the U and O spectra in the simulations is in contrast to the experimentally observed overlapping of the LO1 and TO1 modes that have energies as low as 20 meV with the LA mode that has energies up to 25 meV at the X point along the [001] direction in Fig. 2. The presence of a ∼ 5 meV gap in the simulated (quasi-harmonic) PDOS spectra at ∼ 60 meV is also at variance with the experimental observation of anharmonic linewidth closure of the gap to a spectral dip. The positions of the five observable zone boundary phonon peaks in the simulated PDOS spectra (dashed) in Fig. 3(a) for 295 K agree within ∼ 1 – 3 meV with the measured PDOS peak positions. However, for 1200 K in Fig. 3(b), larger discrepancies (∼ 4 – 5 meV) exist between the positions of the measured and simulated transverse and longitudinal optical zone boundary peaks at 56 and 72 meV.

C. Anharmonic Phonon Linewidth Broadening

The sharpness of the zone boundary phonon peaks in the simulated PDOS spectra in Fig. 3 is of course a result of the absence in the quasi-harmonic approximation PDOS simulations of both anharmonic phonon linewidth and spectrometer instrumental broadening. To put the simulations on the same footing as the measurements for quantitative comparison, the ARCS spectrometer resolution and the previously measured phonon linewidths^2 for UO_2 have been convoluted with the PDOS simulations as described in Appendix A.

Appendix A contains plots of the measured phonon linewidths for UO_2^2 along with a tabular numerical listing of the linewidths as a function of phonon branch and wave vector, q, for both 295 and 1200 K. Appendix A also contains a description of the procedure used for energy averaging over the large (non-statistical) variances in the measured phonon linewidths. The resulting anharmonicity and instrumental broadening convoluted linewidths as a function of energy are shown in Fig. 5 for both 295 and 1200 K. After convoluting the (quasi-harmonic) ab initio simulated PDOS spectra with the respective linewidth curves in Fig. 5, we obtain the thick solid line spectra in Fig. 3, making possible a direct, quantitative comparison with the measured PDOS. For phonon en-

FIG. 3. Neutron-weighted phonon density of states g^{NW}(E ) of UO2 at (a) 295 K and (b) 1200 K by neutron scattering (symbols); quasi-harmonic simulations (thin green lines); and quasi-harmonic simulations convoluted with intrinsic phonon linewidths (thick blue lines). Instrumental resolution is included in all the simulations.

ergies below 25 meV, the convoluted PDOS simulations in Fig. 3 show good agreement with the measured peak positions for the TA and LA phonons at both 295 and 1200 K. However, the spectral weights of the simulations in this energy range are markedly lower than the spectral weight in the measurements. For energies between 25 and 60 meV, there are small variations between the positions of the simulated and measured optical-phonon peak positions for 295 K and somewhat larger discrepancies in the spectrum for 1200 K. More noticeable is that the spectral weight of the simulated PDOS spectra in the 30 – 60 meV range is significantly higher than the PDOS measurements for both 295 and 1200 K. We note, however, that the convolution of phonon linewidths into the simulated spectra reduces the gap at 60 meV in the simulated PDOS spectra to a dip as observed in the measured spectra. Since the area under PDOS spectra are normalized to unity, the enhancement between 30 and 60 meV is offset by the deficiencies in the spectral weights below 25 meV and above 60 meV for both the high and low temperatures. The implications of the differences between the measured and simulated PDOS spectra will be

FIG. 4. Partial contribution to the UO2 PDOS by the one uranium (dashed line) and the two oxygen (solid line) atoms at (a) 295 K and (b) 1200 K.

FIG. 5. Average phonon linewidth measurements of UO2 as a function of energy from single crystal experiment^2, convoluted with the spectrometer ARCS instrumental resolution (see Fig. 7c in Appendix A) at 295 K (thin blue line) and 1200 K (thick red line).

discussed below.

IV. DISCUSSION

A. Experimental PDOS measurements

There are two aspects to note regarding the temperature dependence of the PDOS spectra shown in Fig. 1. The first is that the phonon energy softening observed for 1200 K compared to 295 K does not scale as pre-

FIG. 6. Simulated PDOS of this work using the quasiharmonic approximation at 295 K (thin solid line); Sanati et al.^3 at 0 K (dashed line); Yun et al.^4 at 0 K with lattice parameter adjusted to the 295 K value (dotted line); and Wang et al.^5 (dashed-dotted line) at 0 K; alongside calculated PDOS (thick red line) from shell model based on phonon dispersion measurements at 295 K by Dolling et al.^6

dicted within the quasi-harmonic model for phonon energies,^{22,23} that is the softening does not scale with energy. For instance, the measured energy shift for the acoustic TA peak is about ∼ 1 meV (i.e. from 12 to 11 meV) while the corresponding energy shifts for the ∼ 5 times higher energy optical TO2 and LO2 phonons are also only about 1 meV, from 56 to 55 meV and 72 to 71 meV, respectively. The observation of such departures from the quasi-harmonic model question whether applying the quasi-harmonic approximations in the ab initio simulations for UO_2 would be able to capture the observed phonon energy softening.

The second point is the observation of strong anharmonic broadening of the zone boundary peak at ∼ 33 meV in going from 295 to 1200 K; the other zone boundary peaks are impacted to a much smaller extent. The relatively broad linewidth for the TO1 zone boundary phonons at ∼ 33 meV is apparently due to dispersion as indicated by the width of the TO1 phonon peak in the shell-model fitted PDOS spectrum of Dolling et al.^6 And the large linewidth increases with temperature are in accord with the nearly a factor of 4 increase in linewidth observed for these phonons near the zone boundary X and K points^2 for UO_2 (see TABLE A2).

For the room temperature measurements, we can compare the direct time-of-flight PDOS measurements on polycrystalline UO_2 presented here with Dolling’s shell model derived PDOS spectrum,^6 which was extracted from high-symmetry direction phonon dispersion measurements on single crystal UO_2. Because of the reliance on phonon measurements in the high-symmetry directions only and the relatively large uncertainties for the high energy LO2 phonons in Dolling’s measurements,^6 the reliability of Dolling’s shell model fitted PDOS spectrum has at times been questioned.^{3,5} In order to compare the spectra, it is necessary to neutron-weight the (non-weighted) Dolling spectrum g_{Dolling} (E) in figure 5 of Ref. 6, using Eq. (1) and the partial spectral weight contributions of uranium and oxygen as a function of energy. Since Dolling’s shell model partial contributions were not reported, using our ab initio simulated partial contributions at 295 K plotted in Fig. 4(a), we obtain the neutron-weighted PDOS:

g^{NW}_{Dolling} (E) = g_{Dolling} (E) { σ_U M_U [ g_U (E) g_U (E) + 2g_O(E) ] DF T + 2 σ_O M_O [ g_O(E) g_U (E) + 2g_O(E) ] DF T } (2) After convolution with the 295 K linewidths in Fig. 5 to include the measurement resolution and the anharmonic broadening, we obtain the solid red line in Fig. 3(a). The agreement between Dolling’s neutron-weighted PDOS and our direct PDOS measurements is remarkably good except for the lower spectral weight dips at 25 meV and 65 meV, which we argue are a result of gaps in our ab initio simulated partial contributions that are not present in the experimental dispersion curves of UO_2. That is, the lower than measured spectral weight from 20 – 30 meV in the Dolling PDOS spectrum can be attributed to the lack of an overlap of the uranium and oxygen partial PDOS in the DFT simulation (as was discussed in the Results section above). The upward energy shift of the spectral weight corresponding to LO2 phonons and the ∼ 4 meV higher energy cutoff at 85 meV compared to our PDOS measurement are because the shell model fit of the LO2 dispersion had steeper gradients and higher zone boundary energies than the measured dispersion, as noted already in the paper of Dolling et al.^6 The close agreement of these two PDOS spectra demonstrates the reliability of the PDOS spectra of Dolling derived from dispersion along the three symmetry directions for UO_2. The agreement further validates our procedure of convoluting quasi-harmonic simulated PDOS spectra with the averaged phonon linewidth functions shown in Fig. 5.

B. Experimental PDOS as benchmarks for first-principles simulations for UO2

The good agreement between the time-of-flight PDOS measurements (which include the entire Brillioun zone) and Dolling’s PDOS (extracted from phonon dispersion in the three high symmetry directions) underscores the information available through wave vector resolved dispersion measurements. While the wave vector integrated PDOS measurements contain important information on vibrational entropy and thermodynamic properties,^{22} we focus here on the insight PDOS spectra provide for UO_2 in terms of quantitative phonon energy and dispersion gradient benchmarks^7 for ab initio simulations in this strongly correlated material. We consider first detailed comparisons between our ab initio simulations and our direct measurements of PDOS spectra and then extend the comparisons more generally to recently reported firstprinciples UO_2 simulations.^{3–5}

Before discussing the comparisons, we comment that the use of a 2 × 2 × 2 supercell in the simulations has the limitation that it effectively approximates interatomic forces to vanish for atoms more than one lattice constant apart. However, we note that there are a number of high-symmetry k-points in our 25×25×25 grid for which the phonon wavelengths fit entirely within the supercell. These positions provide test cases with no impact of the supercell size and have been found to fit smoothly with calculations for the non-high symmetry positions of the grid. Moreover, phonon energy calculations with 2×2×2 supercells for the non-strongly correlated isostructural materials CaF_2^{35} and CeO_2^{36} agree well with experimental data.

The first obervation from Fig. 3(a) is that for energies up to 30 meV, the 295 K simulation has significantly lower spectral weights than the PDOS measurements. This apparently stems from two sources, the steeper than measured gradients of the acoustic mode dispersion below ∼ 20 meV and the absence in the simulation of (oxygendominated) optical phonons below 30 meV at 295 K. The absence of optical phonons below 30 meV is in contrast to the dip of energies to as low as 20 meV in the measured dispersion in Fig. 2(a). Moreover, because PDOS spectra are normalized to unity, the lower than measured phonon density of states below 30 meV gives rise to higher than measured optical phonon spectral weight between 30 and 55 meV in the simulation.

Consideration of the PDOS measurements and simulations for 1200 K leads to a similar conclusion. The energies predicted at about 30 meV are ∼ 4 meV higher than measured for both the optical TO1 and the LO1 phonons in the [001] and [011] directions, coupled with flatter dispersion gradients in the simulations. Together with the simulated TO2 energies at ∼ 50 meV being 5 meV lower than measurements, the simulated spectral weight becomes concentrated into a smaller energy width producing a larger spectral weight between 30 and 50 meV for 1200 K than the measured result. It is interesting that the simulated PDOS spectral weight for energies below 30 meV at 1200 K in Fig. 3(b) is in significantly better agreement with the measured PDOS spectrum than for 295 K considering the additional reliance on the quasiharmonic approximation. This improved agreement may be fortuitous since the better agreement for 1200 K stems from the prediction of stronger than measured phonon softening for 1200 K. The larger than measured softening of the optical modes below 30 meV, particularly for the TO1 modes, puts them in better agreement with the measured dispersion curves below 30 meV for 1200 K than for 295 K in Fig. 2(a). Overall, compared to the measured total bandwidth spanning from ∼ 20 – 75 meV for both temperatures, the simulated bandwidths span ∼

25 – 70 meV for 295 K and soften to ∼ 20 – 65 meV for 1200 K.

We consider now the comparison of measured and simulated PDOS spectra as quantitative tests of our lattice dynamics simulations for UO_2, which in turn provides a sensitive test of our ability to describe the strongly correlated electronic structure of UO_2. First-principles lattice dynamics simulations of PDOS for non-strongly correlated materials typically achieve a high level of agreement with PDOS measurements for metals (Al),^{37} semiconductors (Si),^{12} thermoelectrics (AgPb_mSbTe_{2+m}),^{38} intermetallics (Y_3Co)^{39} to oxides (ZnO).^{40} Compared to these materials, the accuracy of the current PDOS simulations for UO_2 is rather limited. Therefore, considering the strong sensitivity of phonon linewidths and thermal transport to phonon energies and dispersion it is important to benchmark ab initio simulations against PDOS measurements detail.

We note that it is not possible to compare the recently reported ab initio PDOS spectra with our neutronweighted PDOS spectra directly without access to their partial contributions analogous to those plotted in Fig. 4 for our simulations. However, with the above demonstration of a direct correspondence of our time-of-flight PDOS measurements with Dolling’s shell model derived PDOS, the comparisons can be performed using Dolling’s “un-weighted” spectra.^6 Accordingly, after convoluting both Dolling’s data and the literature-reported simulated spectra by Sanati et al.,^3 Yun et al.^4 and Wang et al.,^5 with the average anharmonic phonon linewidths in Fig. 5, spectra suitable for comparison were generated. Fig. 6 provides a direct PDOS benchmarking of the ab initio PDOS spectra.

Figure 6 shows anharmonic linewidth convoluted PDOS results for each of these ab initio simulations together with the linewidth convoluted PDOS spectrum of Dolling et al.^6 The introduction of anharmonicity into the respective PDOS spectra by convolution does not add new physics to the comparison. However, it does provide a physically based smoothing of the (non-physical) sharp spectral features of the simulated and the shell-model dependent PDOS resulting from the delta-function energy widths associated with the (quasi)-harmonic nature of the calculations.

We note first of all that the recently published simulations show discrepancies similar to those found with our GGA + U PDOS simulations, which perhaps is not surprising since all of them used the DFT + U approach. At the same time, due to the sensitivity of the PDOS to the details of the simulations, all the published spectra are different from each-other, as well as from our current work. For instance, Sanati et al.^3 used a generalized gradient spin-density approximation (GGSA) at 0 K and neglected LO-TO splitting, whereas the simulations of Wang et al.^5 were performed using the local density approximation with Hubbard-U (LDA + U ) at 0 K. On the other hand, Yun et al.^4 simulated the PDOS spectrum by adapting a spin-polarized GGA approach in which the lattice parameter was adjusted to the experimentally measured value at 295 K. In addition, the issues relating to the ground state in the DFT + U calculations as discussed in Ref. 19 may also influence the resulting phonon spectra.

Overall, none of the simulations reproduce the zone boundary peak energies and spectral weight features of the experimentally measured PDOS as well as those for the non-strongly correlated examples cited above.^{37–40} The low energy uranium dominated TA and LA peak positions deviate by only 1 –2 meV, but the higher energy oxygen vibration dominated peaks are shifted upward (or downward) in energy by 3 –5 meV relative to the measured PDOS. Considering the PDOS measurements reported in the present work and the PDOS spectrum of Dolling in Fig. 6 to be essentially equivalent for comparison with the literature cited simulations, we note that all of the DFT simulations predict a 2:1 ratio for the spectral heights of the TA:LA peaks at ∼ 12 and 21 meV, respectively, while the experimental results show a ratio of 1:1. We observe also that the spectral weights for the optical TO2 zone boundary peak (∼ 56 meV) are larger than experiment for all of the simulations. This correlates with all of the simulations (except those of Wang et al.^5) yielding energies softer than measured for the highenergy LO2 optical phonons,^{3–5} thus pushing their spectral weights to lower energies than measured.^{2,6} We note also that none of the dispersion simulations^{2–5} reproduce the experimentally observed dip of the optical TO1 and LO1 phonons energies to ∼ 20 meV near the zone boundary point X. Since the departures of the simulated PDOS features from the measurements are likely to be sensitive to details within the individual simulations^{19} as well as the differences in the DFT approximations used, we will not discuss the details of the agreement with individual simulations further. However, the issue of the relative heights of the TA and LA peaks, the lack of a TO1 and LO1 dip in energy down to ∼ 20 meV near the X point, and the tendency for extra weight in the 30 –55 meV region suggests a degree of commonality in the deficiencies within the underlying physics of the simulations as well. Roughly speaking, there is a ∼ 10 meV compression in the overall optical mode bandwiths (energy ranges) in the simulations compared to the measurements.

Dynamical mean field theory (DMFT)^{1,18,19}, with the inclusion of fluctuations between electronic states, has also been used in connection with UO_2 simulations at 1000 K to address the strongly correlated 5f electronic structure. However, the DMFT phonon simulations by Yin et al.^1 also fail to capture the experimentally observed^2 dip of the optical TO1 and LO1 phonons below 30 meV near the X zone boundary point. Moreover, the slopes, and hence the group velocities predicted for the LO1 phonons were found to be 2 –3 lower than the measurements. Another approach used to address 5f electron issues is screened hybrid functional DFT (HF-DFT).^{15–17} While phonon dispersion and lifetime calculations have not been reported using HF-DFT, the ability to predict the lattice constant for UO_2^{16,17} without parameter adjustments that are typical within DFT + U simulations is encouraging. Accordingly, it will be interesting to compare PDOS spectra predicted by HF-DFT with the measurements.

V. CONCLUSIONS

The use of time-of-flight INS measurements in connection with ab initio simulations of PDOS for UO_2 has provided direct insight into the large impact of anharmonicity-induced linewidth broadening on the vibrational spectrum at both ambient and high temperatures. The comparisons between the experimentally measured PDOS spectra and ab inito simulations reveal significant deficiencies in the results of presently available^{2–5} quasi-harmonic approaches, underscoring a need for improved ab initio approaches to simulate lattice dynamics and anharmonicity in UO_2. The discrepancies between the measured and the simulated PDOS spectra reported here reside at the level of phonon dispersion, which, as reported previously,^2 in turn strongly influence ab initio simulations of phonon linewidths. Clearly, significant progress is needed to reach in UO_2 the level of accuracy that is currently achievable for the lattice dynamics of non-strongly correlated electron systems. Directions that present themselves are density functional perturbation theory to eliminate potential interaction range issues in the supercell approach or ab initio molecular dynamics to account for finite temperature effects. To address the physics of the highly correlated electronic structure in a more comprehensive manner, the use of other DFT methodologies such as HF-DFT can be considered. At a higher level, DMFT with advanced solvers^{41} provides the ability to address the strongly correlated 5f electrons in UO_2. DMFT can also potentially be used as a basis in the new approaches that are currently under development for ab initio lattice dynamics at finite temperatures. Each of these approaches will require computationally intensive extensions to presently applied methods for UO_2. However, depending on which methods turn out to be successful, achieving accurate PDOS simulations may represent an important step toward understanding the underlying science of the strongly correlated insulator UO_2.

ACKNOWLEDGMENTS

We thank Curtis Maples and Michael Trammell of Oak Ridge National Laboratory (ORNL) for technical support on experimental preparation. Research at ORNL was sponsored by the U.S. Department of Energy (DOE), Office of Basic Energy Sciences (BES), CMSNF, an Energy Frontier Research Center (EFRC) hosted at Idaho National Laboratory. AC and SRP are subcontractors of the U.S. Government under Contract DE-AC07-05ID14517, under the EFRC (Office of Science, BES, FWP 1356).

FIG. 7. UO2 phonon linewidth measurements as a function of energy from single crystal experiment at (a) 295 K and (b) 1200 K. Squares and circles represent the acoustic and optical phonons respectively. Symbol size is proportional to the weigthing of each measurement in the Brillouin zone. Thin red lines are the averaged phonon linewidths; and thick blue lines are convolution of the instrumental linewidth (shown in (c)) with the averaged phonon linewidth.

The Research at ORNL Spallation Neutron Source was sponsored by the Scientific User Facilities Division of BES. WJLB acknowledges the Canadian Institute for Advanced Research. The urania samples were prepared at Los Alamos National Laboratory (LANL) under support by the DOE, Office of Nuclear Energy, Fuel Cycle Research and Development program. LANL is operated by Los Alamos National Security, LLC, for the National Nuclear Security Adminstration of the DOE under contract DE-AC52-06NA25396.

Appendix A: Energy Averaging of Anharmonic Phonon Linewidths

The open squares in Figs. 7(a) and 7(b) represent the linewidths of the acoustic phonons, the open circles denote the linewidths of the optical phonons, and the diameters of the symbols are proportional to their volume weights given by their radial positions in phase space (i.e.

FIG. 8. Simulated PDOS using upper (red dashed curve) and lower (green solid curve) bounds of the linewidth variation with energy. Measurements are shown as symbols.

proportional to |q|^2). The specification of their solid angles, Ω, within the Brillouin zone, their relative weighting as a function of phonon propagation direction [hkl], and their Miller index multiplicities are described in the supplementary information of Ref. 2. Numerical values of the phonon linewidths and corresponding energies for individual phonons measured on single crystals UO_2^2 are listed in Tables A1 – A3.

We emphasize that the large variances in the measured anharmoinc linewidths as a function of energy are not the result of measurement uncertainties; rather, the scatter is a measure of the (non-statistical) range of measured linewidths as a function of acoustic and optical phonon branches and wave vectors. Because PDOS measurements and simulations integrate over all phonon propagation directions, branches, and wave vectors, these linewidths and their variances have been accounted for using the solid line average curves in Figs. 7(a) and 7(b) as determined by 10 meV binning averages of the linewidths up to 35 meV and by a flat line average between 35 and 75 meV. The energy dependence of the “average” anharmonic linewidths for 295 and 1200 K are similar in shape but have an overall factor of ∼ 2.5 increase in the magnitudes of the phonon linewidths going from 295 to 1200 K.

The relatively small linewidths (∼ 0.5 – 1.0 meV) for acoustical phonons (open squares) below ∼ 15 meV are followed by rapidly increasing linewidths up to the LA phonon zone boundary energies of 25 meV. Above 25 meV the phonon linewidths are from optical modes and tend to plateau (albeit with large variances) to about 2.8 meV (3.5 meV) for 295 K and approximately 7.1 (7.54 meV) at 1200 K. We note that the shift from open-square (acoustic) symbols below 25 meV to open-circle (optical) symbols above 25 meV in Figs. 7(a) and 7(b) corresponds to the position of the change from uranium dominated partial PDOS to oxygen-dominated partial PDOS in the ab initio simulations plotted in Fig. 4 in the main text.

The combined anharmonicity and instrumental linewidths were determined by calculating for each of the linewidth points in Figs. 7(a) and 7(b) the root-mean-square sum of the anharmonicity and the corresponding instrumental resolution in Fig. 7(c). To demonstrate that convolution with the average linewidths in the presence of such large variances is meaningful, we plot in Figs. 8(a) and 8(b) convolutions with the upper and lower bounds of the shaded areas in Figs. 7(a) and 7(b). These results verify that the uncertainties introduced by the variances are such that quantitative comparisons can be made between PDOS measurements and simulations. Such comparisons may be done not only in terms of matching PDOS peak positions with zone boundary energies, but also in terms of the phonon group velocities (i.e. phonon dispersion gradients) since the PDOS spectral weights decrease/increase with phonon dispersion gradients.

∗ pangj@ornl.gov 1 Q. Yin and S. Y. Savrasov, Phys. Rev. Lett. 100, 225504 (2008).

2 J. W. L. Pang, W. J. L. Buyers, A. Chernatynskiy, M. D. Lumsden, B. C. Larson, and S. R. Phillpot, Phys. Rev. Lett. 110, 157401 (2013).

3 M. Sanati, R. C. Albers, T. Lookman, and A. Saxena, Phys. Rev. B 84, 014116 (2011).

4 Y. Yun, D. Legut, and P. M. Oppeneer, J. Nucl. Mater. 426, 109 (2012).

5 B.-T. Wang, P. Zhang, R. Lizárraga, I. Di Marco, and O. Eriksson, Phys. Rev. B 88, 104107 (2013).

6 G. Dolling, R. A. Cowley, and A. D. B. Woods, Can. J. Phys. 43, 1397 (1965).

7 J. A. Thomas, J. E. Turney, R. M. Iutzi, C. M. Amon, and A. J. McGaughey, Phys. Rev. B 81, 081411 (2010).

8 T. Lan, X. Tang, and B. Fultz, Phys. Rev. B 85, 094305 (2012).

9 D. A. Broido, M. Malorny, G. Birner, N. Mingo, and D. A.

Stewart, Appl. Phys. Lett. 91, 231922 (2007). 10 X. Tang and J. Dong, Proc. Natl. Acad. Sci. USA 107, 4539 (2010).

11 Z. Tian, J. Garg, K. Esfarjani, T. Shiga, J. Shiomi, and G. Chen, Phys. Rev. B 85, 184303 (2012).

12 A. Ward and D. A. Broido, Phys. Rev. B 81, 085205 (2010).

13 A. A. Maradudin and A. E. Fein, Phys. Rev. 128, 2589 (1962).

14 M. E. Manley, J. R. Jeffries, A. H. Said, C. A. Marianetti, H. Cynn, B. M. Leu, and M. A. Wall, Phys. Rev. B 85, 132301 (2012).

15 F. Jollet, G. Jomard, B. Amadon, J. P. Crocombette, and D. Torumba, Phys. Rev. B 80, 235109 (2009).

16 K. N. Kudin, G. E. Scuseria, and R. L. Martin, Phys. Rev. Lett. 89, 266402 (2002).

17 X.-D. Wen, R. L. Martin, L. E. Roy, G. E. Scuseria, S. P. Rudin, E. R. Batista, T. M. McCleskey, B. L. Scott, E. Bauer, J. J. Joyce, and T. Durakiewicz, J. Chem. Phys. 137 (2012).

18 Q. Yin, A. Kutepov, K. Haule, G. Kotliar, S. Savrasov, and W. Pickett, Phys. Rev. B 84, 195111 (2011).

19 B. Dorado, M. Freyss, B. Amadon, M. Bertolus, G. Jomard, and P. Garcia, J. Phys. Condens. Matter 25, 333201 (2013).

20 Y. Chen, X. Ai, and C. Marianetti, (2013), arXiv:1312.6109.

21 D. L. Abernathy, M. B. Stone, M. J. Loguillo, M. S. Lucas, O. Delaire, X. Tang, J. Y. Y. Lin, and B. Fultz, Rev. Sci. Instrum. 83, 015114 (2012).

22 B. Fultz, Prog. Mater. Sci. 55, 247 (2010).

23 O. Delaire, A. F. May, M. A. McGuire, W. D. Porter, M. S.

Lucas, M. B. Stone, D. L. Abernathy, V. A. Ravi, S. A. Firdosy, and G. J. Snyder, Phys. Rev. B 80, 184302 (2009).

24 C. Dhital, D. L. Abernathy, G. Zhu, Z. Ren, D. Broido, and S. D. Wilson, Phys. Rev. B 86, 214303 (2012).

25 M. Kresch, M. Lucas, O. Delaire, J. Y. Y. Lin, and B. Fultz, Phys. Rev. B 77, 024301 (2008).

26 V. F. Sears, E. C. Svensson, and B. M. Powell, Can. J. Phys. 73, 726 (1995).

27 C. K. Loong, D. G. Hinks, P. Vashishta, W. Jin, R. K.

Kalia, M. H. Degani, D. L. Price, J. D. Jorgensen, B. Dabrowski, A. W. Mitchell, D. R. Richards, and Y. Zheng, Phys. Rev. Lett. 66, 3217 (1991).

28 NIST Center for Neutron Research.

http://www.ncnr.nist.gov/resources/n-lengths/.

29 B. T. M. Willis, Proc. R. Soc. London A 274, 134 (1963). 30 S. Baroni, P. Giannozzi, and E. Isaev, Rev. Mineralogy and Geochemistry 71, 39 (2010).

31 B. Dorado, G. Jomard, M. Freyss, and M. Bertolus, Phys. Rev. B 82, 035114 (2010).

32 G. Kresse and J. Hafner, Phys. Rev. B 47, 558 (1993);

Phys. Rev. B 49, 14251 (1994); G. Kresse and J. Furthmuller, Phys. Rev. B 54, 11169 (1996); Comput. Mater. Sci. 6, 15 (1996).

33 A. Chernatynskiy, “PHONTS,”

http://phonts.mse.ufl.edu; A. Chernatynskiy and

S. R. Phillpot, Phys. Rev. B 82 (2010).

34 Y. Wang, J. J. Wang, W. Y. Wang, Z. G. Mei, S. L. Shang, L. Q. Chen, and Z. K. Liu, Journal of Physics: Condensed Matter 22, 202201 (2010).

35 M. Verstraete and X. Gonze, Phys. Rev. B 68, 195123 (2003).

36 Y. Wang, L. A. Zhang, S. Shang, Z.-K. Liu, and L.-Q.

Chen, Phys. Rev. B 88, 024304 (2013).

37 X. Tang, C. W. Li, and B. Fultz, Phys. Rev. B 82, 184301 (2010).

38 M. E. Manley, S. Shapiro, Q. Li, A. Llobet, and M. E.

Hagen, J. Appl. Phys. 109, 083722 (2011).

39 A. Podlesnyak, G. Ehlers, H. Cao, M. Matsuda, M. Frontzek, O. Zaharko, V. A. Kazantsev, A. F. Gubkin, and N. V. Baranov, Phys. Rev. B 88, 024117 (2013).

40 Z. Wang, F. Wang, L. Wang, Y. Jia, and Q. Sun, J. Appl. Phys. 114, 063508 (2013).

41 B. Amadon, J. Phys. Condens. Matter 24, 075604 (2012).

TABLE A1. Energies (E) and full-width at halfmaximum (2Γ ) of TA and LA phonons in [001], [110] and [111] directions of UO2 determined by single crystal measurements^2 at 295 and 1200 K. Units of E and 2Γ are meV.

TA Wave vectors E295 2Γ295 E1200 2Γ1200 (0,0,0.2) 3.82(2) – 3.56(1) 0.88(2) (0,0,0.4) 7.32(2) 0.50(1) 6.83(3) 0.91(4) (0,0,0.5) – – 8.52(4) 0.98(4) (0,0,0.6) 10.36(2) 0.50(1) 9.74(5) 0.94(8) (0,0,0.7) – – 10.94(7) 0.80(1) (0,0,0.8) 12.57(1) 0.55(1) 11.87(9) 1.00(1) (0,0,0.9) – – 12.43(9) 1.00(2) (0,0,1.0) 13.52(3) – 12.75(9) 0.90(2) (0.2,0.2,0) 5.67(2) – 5.17(2) 1.02(2)

(0.4,0.4,0) 11.36(1) 0.5(1) 10.64(6) 0.93(9) (0.5,0.5,0) 14.36(2) – – – (0.6,0.6,0) 16.87(2) 0.6(2) 15.8(1) 1.0(2) (0.8,0.8,0) 18.26(7) 0.5(1) 19.8(1) 1.0(2) (1.0,1.0,0) 25.91(9) – 24.2(3) – (0.1,0.1,0.1) – – 4.21(2) 0.93(3)

(0.2,0.2,0.2) 7.63(1) 0.5(1) 7.06(2) 0.99(5) (0.3,0.3,0.3) 9.95(1) 0.5(1) 9.28(4) 0.96(5) (0.4,0.4,0.4) – – 10.55(3) 0.94(5) (0.5,0.5,0.5) – – 10.82(5) – LA q E295 2Γ295 E1200 2Γ1200 (0,0,0.2) 8.57(7) – 7.74(4) 1.2(2) (0,0,0.3) 12.88(4) 0.8(2) 12.01(3) 1.1(1) (0,0,0.4) 16.07(5) 0.9(2) 14.97(3) 1.5(1) (0,0,0.5) – – 17.70(4) 2.2(2) (0,0,0.6) 21.21(5) 1.5(2) 19.97(5) 3.1(2) (0,0,0.7) – – 22.35(8) 3.8(3) (0,0,0.8) 24.19(8) 1.8(3) 23.06(5) 2.9(2) (0,0,1.0) 25.9(1) – 24.80(7) – (0.2,0.2,0) 11.56(5) 0.8(2) 11.06(4) 1.7(1)

(0.3,0.3,0) 15.58(3) 1.0(1) 14.88(3) 1.6(1) (0.4,0.4,0) 18.54(5) 1.1(2) 17.82(4) 1.9(2) (0.6,0.6,0) 19.98(7) 1.6(3) 18.96(5) 2.8(2) (0.75,0.75,0) – – 16.22(5) 3.0(3) (0.8,0.8,0) 16.25(5) 1.4(3) 15.30(5) – (0.15,0.15,0.15) – – 9.45(3) 1.39(9)

(0.2,0.2,0.2) – – 12.29(3) 1.9(1) (0.3,0.3,0.3) 17.66(9) 0.9(1) 16.59(4) 2.3(2) (0.4,0.4,0.4) 20.37(3) 1.0(1) 19.17(5) 3.0(2) (0.5,0.5,0.5) 21.13(4) 1.7(3) 19.83(6) –

TABLE A2. Energies (E) and full-width at halfmaximum (2Γ ) of TO1 and LO1 phonons in [001], [110] and [111] directions of UO2 determined by single crystal measurements^2 at 295 and 1200 K. Units of E and 2Γ are meV.

TO1 Wave vectors E295 2Γ295 E1200 2Γ1200 (0,0,0) 33.93(4) – – – (0,0,0.2) 33.78(5) – 32.68(5) 5.6(7) (0,0,0.4) 32.54(5) 1.2(2) 31.06(4) 4.7(7) (0,0,0.6) 30.70(5) 1.3(2) 29.61(5) 5.7(8) (0,0,0.8) 29.19(7) 1.6(3) 28.00(4) 6.5(9) (0,0,1.0) 28.49(9) – – – (0.0,0.0,0) 33.5(1) – 32.3(4) –

(0.2,0.2,0) 32.24(4) 1.1(2) 30.8(1) 2.5(2) (0.4,0.4,0) 29.15(6) 1.5(2) 27.9(3) 4.5(4) (0.6,0.6,0) 25.43(7) 1.2(1) 24.5(2) 3.2(2) (0.8,0.8,0) 22.03(5) 2.5(3) 20.84(6) 4.4(2) (0.0,0.0,0.0) 33.5(1) – 32.3(9) –

(0.1,0.1,0.1) – – 32.9(1) 3.4(3) (0.2,0.2,0.2) 35.98(8) 2.4(3) 34.84(7) 4.9(3) (0.3,0.3,0.3) 39.75(7) 2.9(4) 38.5(2) 6.0(7) (0.4,0.4,0.4) 41.3(5) 3.1(4) 40.0(3) 6(1) LO1 Wave vector E295 2Γ295 E1200 2Γ1200 (0,0,0) 54.2(3) – – – (0,0,0.1) 53.0(2) 3.3(8) 51.1(4) 6(1) (0,0,0.2) 50.9(2) 4.2(9) 49.0(2) 5.9(7) (0,0,0.4) 47.2(2) 5.1(6) 45.5(2) 7(1) (0,0,0.5) – – 40.5(3) 7(1) (0,0,0.6) 38.1(1) 5.5(5) 36.0(3) 12(2) (0,0,0.7) 31.8(2) 5.2(3) 30.0(1) 9.0(5) (0,0,0.8) – – 23.9(1) 8.7(3) (0,0,0.9) – – 20.3(1) 7.5(8) (0,0,1.0) 20.80(6) – 18.9(1) – (0.0,0.0,0) 56.1(3) – – –

(0.1,0.1,0) – – 54.0(3) – (0.2,0.2,0) 54.6(1) – – – (0.3,0.3,0) 52.1(1) – 49.8(2) 3.7(4) (0.4,0.4,0) 47.47(9) 1.5(2) 45.8(2) 4.3(2) (0.5,0.5,0) 44.45(8) 1.9(3) 42.9(2) 7.9(2) (0.6,0.6,0) 40.91(7) 1.6(3) 39.0(1) 7.9(4) (0.7,0.7,0) 35.15(6) 2.6(3) 32.7(2) 9.7(6) (0.8,0.8,0) 31.4(1) 4.0(6) 29.5(2) 7.3(6) (1.0,1.0,0) 27.9(2) – 26.3(3) – (0.0,0.0,0.0) 56.70(4) – – –

(0.1,0.1,0.1) – – 52(1) 6(1) (0.2,0.2,0.2) 53.69(1) 2.4(2) 51(1) 7(1) (0.3,0.3,0.3) 51.97(1) 3.5(3) 50.0(9) 7(2) (0.35,0.35,0.35) – – 49(2) 8(2) (0.4,0.4,0.4) 49.47(1) 4.1(4) 48.3(7) 9(2) (0.5,0.5,0.5) 47.02(5) – 47.1(9) –

TABLE A3. Energies (E) and full-width at halfmaximum (2Γ ) of TO2 and LO2 phonons in [001], [110] and [111] directions of UO2 determined by single crystal measurements^2 at 295 and 1200 K. Units of E and 2Γ are meV.

TO2 Wave vectors E295 2Γ295 E1200 2Γ1200 (0,0,0.2) 54.2(2) 1.8(4) 52.4(4) 5.7(9) (0,0,0.4) 55.2(2) 2.4(4) 53.7(4) 5.3(9) (0,0,0.6) 55.5(2) 2.9(4) 53.1(4) 7(1) (0,0,0.8) 55.4(1) 2.2(5) 52.5(5) 10(1) (0,0,1.0) – – 53.9(4) 7(1) (0.0,0.0,0) 55.7(2) – – –

(0.2,0.2,0) 55.5(2) 1.8(2) 54.4(5) 5.2(6) (0.4,0.4,0) 56.6(2) – 54.7(2) 4.4(5) (0.6,0.6,0) 58.5(2) – 56.6(4) 3.0(5) (0.8,0.8,0) 59.0(3) – 56.9(6) 3.9(4) (0.0,0.0,0.0) 56.2(6) – – –

(0.1,0.1,0.1) – – 52.3(3) 4.1(7) (0.2,0.2,0.2) 54.1(2) 1.0(2) 53.2(2) 5(1) (0.35,0.35,0.35) – – 46.7(6) 3.8(7) (0.4,0.4,0.4) 46.92(4) 1.4(1) – – (0.5,0.5,0.5) 46.0(2) – – – LO2 Wave vector E295 2Γ295 E1200 2Γ1200 (0,0,0.0) 71.1(6) – 71(1) – (0,0,0.2) 71.9(4) 1.9(6) 70.6(6) 9(2) (0,0,0.4) 73.5(2) 2.6(5) 73.9(4) 8(2) (0,0,0.6) 74.3(3) 2.4(7) 74.1(5) 11(2) (0,0,0.8) 75.7(4) – 75.1(9) 9(3) (0,0,1.0) 76.2(6) – 77(1) – (0.0,0.0,0) 70.5(4) – 71(1) –

(0.2,0.2,0) 74.5(7) – 73.9(7) 4(1) (0.4,0.4,0) 72.2(4) 1.2(4) 73.6(6) 8(1) (0.6,0.6,0) 71.5(1) 2.0(5) 70.7(2) 1.9(3) (0.8,0.8,0) – – 73.1(3) – (1.0,1.0,0) 76(1) – 75.1(9) – (0,0,0) 69.7(4) – 69(1) –

(0.1,0.1,0.1) 71.0(2) 3.1(4) 69.1(8) 7.2(2) (0.2,0.2,0.2) – – 71.0(9) 8.2(2) (0.3,0.3,0.3) 70.6(2) 4.9(3) 72.8(9) 7.7(2) (0.4,0.4,0.4) 71.9(2) 4.5(7) 72(1) 8.2(3) (0.5,0.5,0.5) 72.7(4) – 73(1) –