arXiv:1310.2406v1 [physics.plasm-ph] 9 Oct 2013

Improved Collective Thomson Scattering measurements of fast ions at ASDEX Upgrade

J. Rasmussen^∗, S. K. Nielsen^∗, M. Stejner^∗, M. Salewski^∗, A. S. Jacobsen^∗, S. B. Korsholm^∗, F. Leipold^∗, F. Meo^∗, P. K. Michelsen^∗, D. Moseev^†, M. Schubert^{∗∗}, J. Stober^{∗∗}, G. Tardini^{∗∗}, D. Wagner^{∗∗} and the ASDEX Upgrade Team^{∗∗}

∗Association Euratom-DTU, Technical University of Denmark, Department of Physics, DTU Risø Campus, DK-4000 Roskilde, Denmark †Association Euratom-FOM Institute DIFFER, 3430 BE Nieuwegein, The Netherlands ∗∗Max-Planck-Institut für Plasmaphysik, EURATOM-Association, Boltzmannstr. 2, 85748 Garching, Germany

Abstract. Understanding the behaviour of the confined fast ions is important in both current and future fusion experiments. These ions play a key role in heating the plasma and will be crucial for achieving conditions for burning plasma in next-step fusion devices. Microwave-based Collective Thomson Scattering (CTS) is well suited for reactor conditions and offers such an opportunity by providing measurements of the confined fast-ion distribution function resolved in space, time and 1D velocity space. We currently operate a CTS system at ASDEX Upgrade using a gyrotron which generates probing radiation at 105 GHz. A new setup using two independent receiver systems has enabled improved subtraction of the background signal, and hence the first accurate characterization of fast-ion properties. Here we review this new dual-receiver CTS setup and present results on fast-ion measurements based on the improved background characterization. These results have been obtained both with and without NBI heating, and with the measurement volume located close to the centre of the plasma. The measurements agree quantitatively with predictions of numerical simulations. Hence, CTS studies of fast-ion dynamics at ASDEX Upgrade are now feasible. The new background subtraction technique could be important for the design of CTS systems in other fusion experiments.

Keywords: plasma diagnostics, collective Thomson scattering, mm-wave PACS: 52.25.Os, 52.40.Db, 52.50.Gj, 52.55.Pi, 52.70.Gw

INTRODUCTION: THE NEW DUAL-RECEIVER SETUP AT ASDEX UPGRADE

Collective Thomson Scattering (CTS) is based on the scattering of electromagnetic waves off microscopic fluctuations in the plasma. In mm-wave CTS, an incident probe beam with wave vector k^i scatters off ion-driven collective fluctuations in the electron distribution with wave vector k^δ . A receiver antenna accepts a narrow beam of the scattered radiation for which k^s = k^i + k^δ (Fig. 1). For ions moving with velocity v_i, the scattering signal will be frequencyshifted by ω^δ ≈ v_i · k^δ and thus contains information about the ion velocity distribution projected along k^δ . CTS can resolve this scattering signal in both time and space. From this, the distribution function of thermal (bulk) and non-thermal (fast) ions can be inferred, along with the temperature, density and rotation velocity of bulk ions [1].

We have previously operated a CTS system at the medium-sized TEXTOR tokamak, providing the first routine measurements of fast-ion populations in magnetically confined plasmas [2]. Here, time-resolved CTS data showed good agreement with expectations for classical slowing down of the ion velocity distribution after turnoff of auxiliary (neutral beam injection; NBI) heating [3]. However, for some discharges comparison of CTS data with predictions from transport codes showed discrepancies that could potentially be explained by anomalous transport [4].

In this paper we describe the first results obtained with a new dual-receiver CTS setup at ASDEX Upgrade (AUG), including preliminary results on fast-ion dynamics. The CTS system at AUG employs a gyrotron which generates mmwave probing radiation at ν^i = 105 GHz with a typical probing power of ∼ 600 kW. Scattered radiation is directed by steerable mirrors into antennas which feed a heterodyne receiver system [6]. In the previous setup, a single receiver was used for detecting the scattered radiation [7, 8, 9]. By using on/off modulation of the gyrotron probe beam with 2-ms on-times, the background signal, dominated by electron cyclotron emission, was extracted during gyrotron-off periods where there is no CTS radiation. However, background-subtracted spectra frequently indicated the presence of a spurious, residual background signal not expected by CTS theory. Although the spectral power density (SPD) of this

FIGURE 1. CTS geometry in the (left) poloidal and (right) toroidal plane for ASDEX Upgrade discharge 29600 discussed below. The gyrotron probe beam (blue) overlaps with the receiver view (red) in the scattering volume (magenta). For this viewing geometry, the resolved fluctuation vector k^δ makes an angle of 107^∘ to the static magnetic field.

signal remains at the few eV level, it can still have an impact on the interpretation of CTS fast-ion signals which have typical SPD ≈ 1–20 eV. Moreover, the first analyses of 1D fast-ion velocity distributions inferred with CTS at AUG showed some quantitative discrepancies between data and predictions by numerical simulations, despite reasonable qualititative agreement regarding salient features in the spectra [8, 9]. These discrepancies are plausibly related to the presence of this spurious background signal.

While experimental characterization of the spurious signal is underway, a model for its dependence on viewing geometry and plasma parameters is not yet in place. Hence, to help account for this signal, and more generally to provide enhanced flexibility in the CTS setup, the CTS receiver at TEXTOR was recently transferred to AUG as a "passive-view" receiver system. The viewing direction of this receiver does not intersect the probe beam (see Fig. 1) and hence does not measure CTS. However, the receiver has the same poloidal viewing geometry and sees the same spurious signal as the "active-view" receiver. Data from the new passive view can therefore be used to characterize the residual non-CTS signal seen by the active-view receiver. As explained, the resulting improvement in the background estimation is of particular importance for the interpretation of fast-ion CTS data.

FIRST CTS RESULTS ON FAST-ION DYNAMICS AT ASDEX UPGRADE

As a first application of the new dual-receiver background approach, we here present results obtained for the fastion populations in AUG discharge 29600. This was a standard H-mode discharge with B_t = 2.55 T, I_p = 0.8 MA, and central electron density n_e = 6.6 × 10^{19} m^{−3}. The scattering volume was placed near the centre of the plasma, at (R,z) = (1.67m,−0.10m) as estimated from ray-tracing. The CTS temporal and radial spatial resolution for this discharge were 5 ms and 6 cm, respectively. The angle between the resolved plasma fluctuations and the toroidal B-field was̸ (k^δ ,B) = 107^∘ (see Fig. 1). Co-current neutral beam heating from two sources with similar injection geometry, Q3 (60 keV injection energy) and Q8 (93 keV), was employed both independently and together during the discharge to study the slowing down of fast ions in the plasma.

By combining a forward model of the scattering [10, 11] with the fast-ion velocity distribution in the scattering volume predicted by the transport code TRANSP [12], one can generate synthetic CTS spectra for comparison to the real measurements. Previous such comparisons showed that salient features of simulation and experiment agree, but inexplicable quantitative discrepancies remained, with CTS spectra unexpectedly suggesting the presence of a significant fast-ion population with velocities above the NBI injection velocity [9]. For discharge 29600, Fig. 2a shows a comparison between synthetic and measured spectra for three different NBI heating phases. With the improved background subtraction, predicted and observed spectra agree quantitatively during all three phases. As shown in Fig. 2b, the improved background subtraction also enables us, for the first time, to clearly observe the expected broadening of the CTS spectrum with increasing NBI heating energy.

Fitting the observed CTS spectra with our forward model [13], the 1D (fast) ion velocity distribution g(u), which is the projection of the fast-ion distribution function onto k^δ , can be inferred. As this represents a complicated inverse

FIGURE 2. (a) CTS spectra obtained at the end of three separate NBI heating phases, compared to synthetic spectra of the total (blue) and fast-ion (green) components. (b) Comparison of CTS spectra during phases with and without one-beam NBI heating. The CTS data have been averaged over 10 gyrotron pulses. Dotted line marks ν^i of the gyrotron beam.

FIGURE 3. (a) Comparison of simulated g(u) from TRANSP (lines) with those inferred from the corresponding synthetic CTS spectra (data points) during one- and two-beam heating phases. (b) Simulated g(u) compared to the values inferred from real CTS data during the same two NBI phases. (c) g(u) from CTS data with and without one-beam NBI heating.

problem, it is useful to first verify that the g(u) inferred from synthetic spectra – i.e. those shown in Fig. 2 – correctly recover the underlying true g(u) predicted with TRANSP for the given scattering geometry [9]. In Fig. 3a we show that this is indeed the case during both one- and two-beam heating phases for the projected ion velocities u beyond the Maxwellian bulk. Fig. 3b plots the corresponding comparison for the real CTS data shown in Fig. 2, demonstrating, for the first time, good agreement between theory and experiment during both these heating phases. Finally, Fig. 3c shows that the impact of increasing NBI heating energy can be discerned in 1D velocity space too, as heating with Q8 produces a broader velocity distribution than with Q3, and as no supra-thermal ions are present when NBI is off.

These new results represent a major breakthrough for CTS at AUG and open up for studies of fast-ion dynamics in the present discharge. In Fig. 4a we investigate the slowing down of fast ions after auxiliary heating is switched off, by plotting the CTS signal within selected frequency ranges Δν that cover bulk and fast ions. Once heating with ECRH and NBI Q8 is switched off at t ≃ 5.5 and 5.6 s, respectively, both T_e and T_{ion} drop from 2.5 to 1.0 keV, and the SPD for bulk ions at frequencies outside the rejection frequencies of the notch filters declines. Ions with 0.5 < Δν < 0.7 GHz are predominantly supra-thermal and also exhibit a drop but retain an average SPD > 0 until Q3 is also turned off. Even larger frequency shifts (0.7–1.0 GHz) are observed only during two-beam heating. No CTS signal is expected nor observed for Δν > 1.5 GHz. With the low SPDs involved, accurate background subtraction is clearly key to identifying these trends.

In Fig. 4b, we integrate the inferred g(u) over three 1D fast-ion velocity intervals, to derive associated partial fast ion densities N_{fast} [5]. All three velocity ranges are represented during the two-beam heating phase, but once Q8 is switched off, the faster ions are slowed down, and N_{fast} relaxes to a new quasi-steady state in Δt ≈ 100 ms. Turning off Q3 as well leads to complete absence of a fast-ion CTS signal. These results agree with expectations from Figs. 2 and 3, and demonstrate that CTS studies of fast-ion dynamics at ASDEX Upgrade are now feasible.

FIGURE 4. (a) Time traces of AUG discharge 29600, showing NBI and ECRH heating power, electron density and temperature from Integrated Data Analysis (IDA), ion temperature from charge exchange recombination spectroscopy, and mean SPD in various frequency ranges Δν = |ν − ν^i| as labelled. (b) Preliminary partial fast-ion densities derived in three 1D velocity intervals.

SUMMARY AND OUTLOOK

An operating scenario for CTS has now been established at ASDEX Upgrade, relying on a new dual-receiver background subtraction technique. Application of this technique is especially important for deducing properties of fast ions, for which the CTS signal is generally relatively low. With this technique, the inferred properties of fast-ion populations are, for the first time, in good quantitative agreement with theoretical expectations during both one- and two-beam neutral beam injection and when no beams are injected. This represents a breakthrough for CTS at AUG and enables the first CTS studies of fast-ion dynamics at this machine. In the short term, our next step will be to provide measurements in multiple scattering volumes using the new background subtraction technique. Furthermore, we intend to replace the digital 2-ms on/off modulation of the probing gyrotron by 3 kHz analog modulation, in order to provide better time resolution than the current ≥ 4 ms. In the longer term, we anticipate that the results obtained with the new dual-receiver setup could be important for the design of CTS systems in other fusion experiments, where determination of fast-ion distribution functions throughout the plasma is of central importance.

ACKNOWLEDGMENTS

We thank Henrik Bindslev for fruitful discussions. This work, supported by the European Communities under the contract of Association between Euratom and DTU, was partly carried out within the framework of the European Fusion Development Agreement. The views and opinions expressed herein do not necessarily reflect those of the European Commission.

REFERENCES

1. S. B. Korsholm, et al., Nuclear Instruments & Methods in Physics Research A. 623(2), 677–680 (2010). 2. H. Bindslev, et al., Phys. Rev. Letters 97(20), 205005 (2006). 3. S. K. Nielsen, et al., Phys. Rev. E, 77(1), 016407 (2008).

4. D. Moseev, et al, Plasma Physics and Controlled Fusion 53(10), 105004 (2011). 5. S. K. Nielsen, et al., Nuclear Fusion 51(6), 063014 (2011). 6. V. Furtula, et al., Review of Scientific Instruments 83(1), 013507 (2012). 7. F. Meo, et al., Review of Scientific Instruments 79(10), 10E501 (2008). 8. F. Meo, et al., Journal of Physics: Conference Series (Online) 227, 012010 (2010). 9. M. Salewski, et al., Nuclear Fusion 50(3), 035012 (2010).

10. H. Bindslev, Plasma Physics and Controlled Fusion 35(11), 1615–1640 (1993). 11. H. Bindslev, J. Atmos. Terr. Phys. 58, 983 (1996). 12. A. Pankin, et al., Comp. Phys. Comm. 159, 157 (2004). 13. H. Bindslev, Rev. Sci. Instrum. 70, 1093–1099 (1999).