arXiv:1305.4837v1 [astro-ph.SR] 21 May 2013

Astronomy & Astrophysics manuscript no. NGC7492_rev © ESO 2019 May 7, 2019

Variable stars in the globular cluster NGC 7492.^⋆

New discoveries and physical parameters determination.

R. Figuera Jaimes^{1, 2} A. Arellano Ferro^3 D.M. Bramich^1 Sunetra Giridhar^4 and K.Kuppuswamy^4

1 European Southern Observatory, Karl-Schwarzschild-Straβe 2, 85748 Garching bei München, Germany.

e-mail: rfiguera@eso.org, robertofiguera@gmail.com, dan.bramich@hotmail.co.uk 2 SUPA, School of Physics and Astronomy, University of St. Andrews, North Haugh, St Andrews, KY16 9SS, United Kingdom.

3 Instituto de Astronomía, Universidad Nacional Autónoma de México, Apdo. Postal 70-264, México D. F. CP 04510, México.

e-mail: armando@astro.unam.mx 4 Indian Institute of Astrophysics, Bangalore, India.

Received November 5, 2012; accepted December 1, 2012

ABSTRACT

Aims. We have performed a photometric V, R, I CCD time-series analysis with a baseline of ∼8 years of the outer-halo globular cluster NGC 7492 with the aim of searching for new variables and using these (and the previously known variables) to determine the physical parameters of interest for the cluster (e.g. metallicity, absolute magnitude of the horizontal branch, distance, etc.). Methods. We use difference image analysis (DIA) to extract precise light curves in the relatively crowded star field, especially towards the densely populated central region. Several approaches are used for variability detection that recover the known variables and lead to new discoveries. We determine the physical parameters of the only RR0 star using light curve Fourier decomposition analysis. Results. We find one new long period variable and two SX Phe stars in the blue straggler region. We also present one candidate SX Phe star which requires follow-up observations. Assuming that the SX Phe stars are cluster members and using the period-luminosity relation for these stars, we estimate their distances as ∼25.2±1.8 and 26.8±1.8 kpc, and identify their possible modes of oscillation. We refine the periods of the two RR Lyrae stars in our field of view. We find that the RR1 star V2 is undergoing a period change and possibly exhibits the Blazhko effect. Fourier decomposition of the light curve of the RR0 star V1 allows us to estimate the metallicity [Fe/H]_{ZW} ∼-1.68±0.10 or [Fe/H]_{UVES} ∼-1.64±0.13, log-luminosity log(L/L_⊙) ∼1.76±0.02, absolute magnitude M_V ∼0.38±0.04 mag, and true distance modulus of μ_0 ∼16.93±0.04 mag, which is equivalent to a distance of ∼24.3±0.5 kpc. All of these values are consistent with previous estimates in the literature.

Key words. Globular clusters– NGC 7492– Physical parameters– Variable stars– SX Phe– RR Lyrae

1. Introduction

The potential of difference image analysis (DIA) as a powerful tool for unveiling short period variable stars, or small amplitude variations in Blazhko RR Lyraes, in the densely populated central regions of globular clusters (GC), has been demonstrated in recent papers (e.g. Kains et al. 2012; Arellano Ferro et al. 2012, 2011; Bramich et al. 2011; Corwin et al. 2006; Strader et al. 2002, etc). Multi-colour time-series CCD photometry allows the identification of variable stars in specific regions of the colour-magnitude diagram (CMD). The Fourier decomposition of RR Lyrae light curves enables us to derive stellar parameters. In the Blue Straggler region, SX Phe stars are often found and depending on the number of them in the cluster, their Period- Luminosity relation (P-L) can be calibrated or it can be used to obtain an independent estimate of the distance to the cluster.

In the present paper we focus on the globular cluster NGC 7492. This is a rather sparse outer-halo cluster (R_{GC} ∼25 kpc; Harris (1996) (2010 edition)) for which detailed spectroscopic abundances exist ([Fe/H] ∼ −1.8) for four stars at the tip of the red giant branch (RGB) (Cohen & Melendez

⋆ Based on observations collected at the Indian Astrophysical Observatory, Hanle, India.

2005). Hence the cluster offers a good opportunity to compare the spectroscopic results with the metallicity derived from the light curve Fourier decomposition approach for RR Lyrae stars. According to the Catalogue of Variable Stars in Globular Clusters (CVSGC) (Clement et al. 2001), only four variable stars are known in this cluster; namely one RR0 (V1), discovered by Shapley (1920), two RR1 (V2 and V3) and one long period variable (LPV; V4), all discovered by Barnes (1968). Although Buonanno et al. (1987) suggest the presence of a population of blue stragglers in this cluster and numerous blue stragglers have been identified by Côté et al. (1991), no investigation into the variability of these otherwise faint stars (V ∼20 mag) has been reported. Taking advantage of our time-series CCD photometry of the cluster and our capability of performing precise photometry via DIA, we explore the field of the cluster for new variables.

In § 2 we describe the observations, data reduction, and transformation of the photometry to the Johnson-Kron-Cousins standard system. In § 3 we present a detailed discussion of the strategies employed for the identification of new variables. In § 4 the physical parameters of the RR0 star as derived from the Fourier decomposition of its light curve and the Blazhko effect for the RR1 star are discussed. In § 5, we make brief comments on the long term variables. In § 6 we present a discussion for the

Article number, page 1 of 12

Table 1. Distribution of observations of NGC 7492 for each filter.

Date N_V t_V (s) N_R t_R (s) N_I t_I (s) 20041004 7 60-200 7 150-180 – – 20041005 16 60-120 14 100 – – 20060801 8 120 7 100 – – 20070804 6 240 7 100-180 – – 20070805 4 240 3 120-180 – – 20070904 8 180-240 8 120-180 – – 20070905 8 180 8 120 – – 20090107 4 100 – – 5 100-300 20090108 5 300 – – 5 220-300 20120628 37 90-180 – – – – 20120629 16 200 – – – – TOTAL: 119 54 10

Notes.^{(a)} N_V , N_R and N_I are the number of images taken for the filters V, R, and I respectively.^{(b)} t_V , t_R and t_I are the exposure times, or range of exposure times, employed during each night for each filter.

newly found SX Phe stars and candidates and in § 7 we summarize our results.

2. Observations and reductions

The observations employed in the present work were obtained, using the Johnson-Kron-Cousins V, R and I filters, on the dates listed in table 1. We used the 2.0m telescope of the Indian Astronomical Observatory (IAO) at Hanle, India, located at 4500m above sea level. The typical seeing was ∼1.3 arcsec. The detector was a Thompson CCD of 2048 × 2048 pixels with a pixel scale of 0.296 arcsec/pix and a field of view of ∼ 10.1 × 10.1 arcmin^2. However, for this cluster we can only apply DIA to smaller images that cover an area of ∼6.4×5.5 arcmin^2 centred on the cluster because of a lack of sources towards the detector edges for use in the kernel solutions. Our data set consists of 119 images in V, 54 images in R, and 10 images in I.

The images were calibrated via standard overscan bias level and flat-field correction procedures, and difference image analysis (DIA) was performed with the aim of extracting high precision time-series photometry of the stars in the field of NGC 7492. We used the DanDIA^1 pipeline for the data reduction process which models the convolution kernel matching the point-spread function (PSF) of a pair of images of the same field as a discrete pixel array (Bramich 2008; Bramich et al. 2013). A brief summary of the DanDIA pipeline can be found in Arellano Ferro et al. (2011) while a detailed description of the procedure and its caveats is available in Bramich et al. (2011).

The reference image for each filter was constructed by registering and stacking the best-seeing calibrated images such that all images used were taken on a single night. This resulted in 2, 4, and 1 images being stacked with total exposure times of 120, 400 and 100 s for the filters V, R and I, respectively.

The light curve data in all three filters for all of the variable stars is provided in table 3. In addition to the star magnitudes, we supply the difference fluxes f_{diff}(t) (ADU/s), the reference flux f_{ref} (ADU/s) and the photometric scale factor p(t), at time t, as provided by the DanDIA pipeline. These quantities are linked to the instrumental magnitudes m_{ins} via the equations

f_{tot}(t) = f_{ref} + f_{diff}(t) p(t) (1) m_{ins}(t) = 25.0 − 2.5 log( f_{tot}(t)). (2)

1 DanDIA is built from the DanIDL library of IDL routines available at http://www.danidl.co.uk

Fig. 1. Photometric transformation relations between the instrumental v, r, i and the standard V, R, I magnitudes using the standard stars from Stetson (2000).

2.1. Transformation to the VRI standard system

The instrumental v, r, i, magnitudes were converted to the Johnson-Kron-Cousins photometric system (Landolt 1992) by using the standard stars in the field of NGC 7492. The V, R and I standard stars and their magnitudes are available in the catalogue of Stetson (2000)^2. Fig. 1 displays the relations between the instrumental and standard magnitude systems as a function of instrumental (v − r) colour, where we found mild colour dependencies. The standard stars that we used have a colour range between -0.02< V − R <0.53 mag and 0.02< V − I <1.10 mag which covers the range of colours of the stars in our field of view. To convert the instrumental magnitudes to standard magnitudes for the stars without an instrumental v − r colour, we assumed a value of v − r = 0.286 mag corresponding to the centre of the spread of instrumental v − r star colours.

2.2. Astrometry and finding chart

We fit a linear astrometric solution derived for the V filter reference image by matching 37 hand-picked stars with the UCAC3 star catalogue (Zacharias et al. 2010) using a field overlay in the image display tool GAIA (Draper 2000). We achieved a radial RMS scatter in the residuals of ∼0.24 arcsec which is equivalent to ∼0.82 pixels. To facilitate the identification of the variable stars in this cluster in future studies, we have produced a finding chart which we present in figure 2. In addition, in Table 2 we present the equatorial J2000 celestial coordinates of all of the variable stars discussed in this work. This astrometric solution is in perfect agreement with the astrometry given by Stetson (2000) for the standard stars in this cluster.

2 http://www3.cadc-ccda.hia-iha.nrc-cnrc.gc.ca/community/STETSON/standards

Article number, page 2 of 12

R. Figuera Jaimes A. Arellano Ferro D.M. Bramich Sunetra Giridhar and K.Kuppuswamy: Variables in NGC 7492.

Table 2. Celestial coordinates for all of the confirmed and candidate variables in our field of view, except V3 which lies outside of our field of view. The coordinates correspond to the epoch of the V reference image, which is the heliocentric Julian date ∼2453284.26 d. We also include in this table, the epoch, period, mean V magnitude, V − R colour and the full amplitude of each variable.

ID type RA DEC Epoch P V V − R Amp (V) Amp(R) (J2000) (J2000) (days) (days) (mag) (mag) (mag) (mag) V1 RR0 23:08:26.68 -15:34:58.5 2453949.4046 0.805012 17.303^b 0.264^b 0.511 0.408 V2 RR1 23:08:25.00 -15:35:52.9 2453284.2652 0.411764^a 17.256^b 0.188^b 0.251 0.140 V4 LPV 23:08:23.19 -15:39:06.0 – ∼21.7 14.271^c – ∼0.18 – V5 LPV 23:08:39.08 -15:34:36.3 – – 14.258^c – >0.33 – V6 SX Phe 23:08:29.16 -15:36:51.1 2454318.3687 0.0565500 19.235^b 0.166^b 0.136 0.058 V7 SX Phe 23:08:19.83 -15:37:33.6 2454839.0479 0.0725859 19.363^b 0.448^b 0.050 – CSX1 SX Phe? 23:08:32.73 -15:35:03.4 – – 19.499^c 0.210^c ∼0.15 0.09?

Notes.^{(a)} If we consider a secular period change then the period is P_0 = 0.412119 d at the epoch E =2453284.2652 d and the period change rate is β ≈ 47 d Myr^{−1}.^{(b)} Intensity weighted magnitude calculated from the light curve model.^{(c)} Mean magnitude from our data.

Table 3. Time-series V, R and I photometry for all of the confirmed and candidate variables in our field of view. Note that V3 lies outside of our field of view. The standard M_{std} and instrumental m_{ins} magnitudes are listed in columns 4 and 5, respectively, corresponding to the variable star, filter, and heliocentric Julian Date of mid-exposure listed in columns 1-3, respectively. The uncertainty on m_{ins} is listed in column 6, which also corresponds to the uncertainty on M_{std}. For completeness, we also list the quantities f_{ref}, f_{diff} and p from Equation 1 in columns 7, 9 and 11, along with the uncertainties σ_{ref} and σ_{diff} in columns 8 and 10. This is an extract from the full table, which is available with the electronic version of the article.

Variable Filter HJD M_{std} m_{ins} σ_m f_{ref} σ_{ref} f_{diff} σ_{diff} p Star ID (d) (mag) (mag) (mag) (ADU s^{−1}) (ADU s^{−1}) (ADU s^{−1}) (ADU s^{−1}) V1 V 2453283.25245 17.400 18.014 0.009 558.913 0.904 64.366 4.992 1.0059 V1 V 2453283.28310 17.444 18.058 0.005 558.913 0.904 39.065 2.618 0.9944 . . . . . . . . . . . . . . . . . . . . . . V1 R 2453283.27903 17.162 17.769 0.004 786.605 0.821 -5.906 3.044 1.0210 V1 R 2453283.28689 17.153 17.759 0.004 786.605 0.821 0.832 3.034 1.0184 . . . . . . . . . . . . . . . . . . . . . . V1 I 2454839.03764 16.575 17.636 0.010 865.889 3.651 16.109 8.462 0.9974 V1 I 2454839.04150 16.577 17.639 0.007 865.889 3.651 14.141 5.362 0.9945 . . . . . . . . . . . . . . . . . . . . . . 3. Variable star search strategies

3.1. Standard deviation

V light curves were produced for 1623 stars in the field of our images. The mean magnitude, computed using inverse variance weights, and the RMS were calculated for each light curve. Fig. 3 shows the RMS as a function of the mean magnitude for the V, R and I filters and indicates the precision of our photometry. Stars with a large dispersion for a given mean magnitude, in principle, are good candidate variables. However, it is possible that a light curve has a large RMS due to occasional bad measurements of the corresponding star in some images, in which case the variability could be spurious.

We have used the RMS values as a guide to our search for variables. The two known RR Lyrae stars (V1 and V2) and the known red giant variable (V4) are highlighted with colours as indicated in the caption of Fig. 3. They clearly stand out from the general trend. V3 is not in the field of our images. With this method we have also identified another long period variable discussed later in this paper which we have labelled as V5. While this method is useful for detecting bright variables, it is not useful for detecting shorter period faint variables in the blue straggler region. It is clear from the red points, which correspond to two new SX Phe and one candidate SX Phe, that they do not stand out in the plot relative to other faint non-variable stars. For these variables, we have used a different approach described in the following sections.

3.2. String-length period search

The light curves of the 1623 stars measured in each of the 119 V images were analyzed by the string-length minimization approach (Burke et al. 1970; Dworetsky 1983). In this analysis, the light curve is phased with numerous test periods within a given range. For each period the dispersion parameter S_Q is calculated. When S_Q is at a minimum, the corresponding period produces a phased light curve with a minimum possible dispersion and it is adopted as the best-fit period for that light curve. Bona fide variable stars should have a value of S_Q below a certain threshold. Similar analyses of clusters with numerous variables have shown that all periodic variables with long periods and large amplitudes are likely to have S_Q ≤ 0.3. However short-period small-amplitude variables like SX Phe are often missed by this approach (Arellano Ferro et al. 2004, 2006). Fig. 4 shows the distribution of S_Q values for all stars measured in the V images, plotted as a function of an arbitrary star number. We explored individually the light curves below the indicated threshold of S_Q = 0.3. With this method we recover the two RR Lyrae stars in the field of our images (V1 and V2), the

Article number, page 3 of 12

Fig. 2. Finding charts constructed from our V reference image; north is up and east is to the right. The cluster image is 6.36×5.52 arcmin^2, and the image stamps are of size 23.7×23.7 arcsec^2. Each variable (except V4 and V5) lies at the centre of its corresponding image stamp and is marked by a cross-hair.

LPV V4, and we discovered the LPV V5. The others stars below this threshold were not found to display true variations.

3.3. Colour-magnitude diagram

The CMD is very useful for separating groups of stars that are potential variables, e.g. in the horizontal branch (HB), the RGB and the blue straggler region. Fig. 5 shows the V versus (V − R) diagram. The known RR0 and RR1 stars contained in our field of view are shown as dark blue and green circles, respectively. The known red giant variable V4 is not shown because it is saturated in our R reference image and V5 is saturated in the R and I reference images. The blue straggler region has been arbitrarily defined by the red box in this CMD. We selected the faint limit such that the photometric uncertainty is below 0.1 mag and the red limit so that the region is not too contaminated by the main sequence.

Article number, page 4 of 12

R. Figuera Jaimes A. Arellano Ferro D.M. Bramich Sunetra Giridhar and K.Kuppuswamy: Variables in NGC 7492.

Fig. 3. RMS magnitude deviation as a function of the mean magnitude in the filters V, R, and I. Known variables are labelled. V1 (dark blue point) and V2 (green point) are two known RR Lyrae stars in the field of the cluster. Red circles correspond to two newly identified SX Phe stars and one candidate SX Phe. The variable V4 is saturated in our R reference image and the newly identified variable V5 is saturated in the R and I reference images. Hence these stars are not shown in the corresponding plots. The cyan points correspond to the blue stragglers identified by Côté et al. (1991).

Fig. 4. S_Q values for all the stars in the V images as a function of an arbitrary star number. The blue line is the threshold below which RR Lyrae stars tend to be found. The known variables V1, V2 and V4 are labelled as well as the newly identified long period variable V5, the new SX Phe V6 and V7 and one candidate SX Phe star (red points). The cyan points correspond to the stars identified by Côté et al. (1991) as blue stragglers.

It is worth noting that in the HB, the RR Lyrae region is populated only by two of the three already known RR Lyrae stars and one more star labelled as C in the figure. The light curve of star C does not show signs of variation at the precision of our data (∼0.02 mag), hence the star may be a field object. Furthermore, there are no saturated stars in the field of view of our V filter images. Therefore, with a typical precision of ∼0.01-0.02 mag in our V light curves at the magnitude of the HB (∼17.3 mag), we can be sure that there are no more RR Lyrae stars in the cluster in our field of view (Fig. 2).

Fig. 5. CMD of NGC 7492. Two known RR Lyrae variables V1 and V2 are marked with dark blue and green symbols respectively. The new SX Phe variables V6 and V7 and one candidate SX Phe are shown with red symbols. The cyan points correspond to the blue stragglers identified by Côté et al. (1991). The red box is an arbitrarily defined Blue Straggler region (see text).

3.4. Variability detection statistic S_B

We also analysed the light curves for variability via the detection statistic S_B defined by Arellano Ferro et al. (2012) and employed by these authors to detect amplitude modulations in RR Lyrae stars attributed to the Blazhko effect. The variability detection statistic S_B was inspired by the alarm statistic A defined by Tamuz et al. (2006), designed originally for improving the fitting of eclipsing binary light curves. The advantages of redefining the alarm statistic as:

S_B = � 1 NM �_M� i=1 � r_{i,1} σ_{i,1} + r_{i,2} σ_{i,2}

+ ... + r_{i,ki} σ_{i,ki}

�_2 , (3)

have been discussed by Arellano Ferro et al. (2012). In this equation, N represents the total number of data points in the light curve and M is the number of groups of time-consecutive residuals of the same sign from a constant-brightness light curve model. The residuals r_{i,1} to r_{i,ki} form the ith group of k_i timeconsecutive residuals of the same sign with corresponding uncertainties σ_{i,1} to σ_{i,ki} . Our S_B statistic may therefore be interpreted as a measure of the systematic deviation per data point of

Article number, page 5 of 12 the light curve from a non-variable (constant-brightness) model. We note that in Arellano Ferro et al. (2012) the residuals r_{i, j} are calculated relative to the Fourier decomposition light curve model rather than relative to a constant-brightness model used in this work. It is this difference in application that makes S_B a detection statistic for the Blazhko effect in Arellano Ferro et al. (2012) and a detection statistic for variability in this paper.

Equation 3 has been modified from the corresponding equation in Arellano Ferro et al. (2012) by further normalising the S_B statistic by M. This modification serves to improve the discriminative power of the statistic because variable stars, as opposed to non-variable stars, have longer time-consecutive runs of light curve data points that are brighter or fainter than the constantbrightness model, and therefore smaller values of M (for a given light curve N).

We calculated S_B for each of our V and R light curves and we made plots of S_B versus magnitude in each filter. The variables detected so far by the methods discussed in Sections 3.1- 3.3 (V1, V2, V4 and V5) stand out in these diagrams with very large S_B values compared to the other stars. However, we found that we could make these differences in the S_B values between variable and non-variable stars even larger by calculating S_B for the combined VR light curves. In this case, for each star, we adjust the R light curve so that its mean magnitude matches that of the corresponding V light curve, and then we calculate S_B for the combined VR light curve^3.

In Fig. 6 we plot S_B for each of the combined VR light curves as a function of the V mean magnitude. The RR Lyrae stars V1 and V2 clearly have S_B values among the largest in the light curve sample. It is interesting to note that S_B generally scatters around a constant value (∼0.03) for V fainter than ∼19 mag. For stars brighter than V ∼19 mag, the S_B values show an exponential increase (which appears as linear on the log-scale of Fig. 6). This feature can be explained by considering the systematic errors that exist at some level in all the light curves. However, we defer the relevant dicussion of this topic until later in this section.

To detect new variable stars, we need to define a detection threshold that optimises our sensitivity to real variables while being set high enough to minimise the number of false alarms (i.e. classification of non-variable stars as variable). Without setting this detection threshold carefully, one runs the risk of publishing suspected variable stars of which the majority may be refuted in subsequent photometric campaigns (see Safonova & Stalin (2011) and Bramich et al. (2012) papers for a good example). We decided to determine the threshold for our S_B statistic through the use of simulations.

For each combined VR light curve in our sample, we performed 10^6 simulations. Each simulation consists of generating a random light curve m_i using the real light curve data point uncertainties σ_i via:

m_i = V + λ_iσ_i, (4)

where the λ_i are a set of random deviates drawn from a normal distribution with zero mean and unit σ, and V is the mean V magnitude of the real light curve. We calculated S_B for the simulated light curves and obtained a distribution of 10^6 S_B values from which we determined the median (50%) and 99.9% percentile.

3 This procedure is valid for the variable stars in our data because the data points in our light curves generally alternate between the two filters and therefore the light curve data in each filter has approximately the same phase coverage.

Fig. 6. S_B statistic as a function of V mean magnitude for the VR combined light curves. The RR Lyrae stars V1 and V2 are labelled, as are the new SX Phe stars V6 and V7 and the one candidate SX Phe star. The cyan points correspond to the blue stragglers identified by Côté et al. (1991). The long period variables V4 and V5 do not appear on this plot because they are saturated in the R filter. The solid blue curve is the median (50%) curve determined from our simulations and adjusted to fit the real S_B data above V ∼19 mag. The dashed red curve represents our variable star detection threshold in S_B set using our simulations to limit our false alarm rate to ∼0.1%. The solid red curve represents our adopted variable star detection threshold when we take into account the systematic errors. We further limited our variable star search to stars brighter than V =20.6 mag (vertical dashed red line).

We found that the median values of the S_B distributions are approximately the same (to within the noise of the finite number of simulations) for all of our stars, as are the 99.9% percentile values, which implies that for light curves with the same number of data points, the actual distribution of data point uncertainties has no impact on the threshold to be chosen for S_B. We found that for our combined VR light curves, the mean of the S_B distribution medians is ∼0.0256, and the mean of the 99.9% percentiles is ∼0.0525. These lines are plotted in Fig. 6 as the horizontal dashed blue and red lines.

Looking again at Fig. 6 we now see that the S_B values for the real light curves scatter close to the median line from the simulations for stars fainter than V ∼19 mag, which implies that for these stars the simulations provide a reasonably good model for the noise in the real light curves. However, for the stars brighter than V ∼19 mag, the S_B values for the real light curves increase exponentially with increasing brightness and are much larger than what we would expect as determined from our light curve simulations with pure Gaussian noise. We can explain this by considering that the systematic errors in the light curves, which correlate over groups of time-consecutive data points and therefore mimic real variability, increasingly dominate the noise in our real light curves with increasing star brightness. To account for the systematic errors, we need to adjust our median and 99.9% percentile curves in Fig. 6, which we do by fitting a linear relation to the log-S_B values for V brighter than 19 mag and merging this fit with the constant median curve for V fainter than 19 mag (solid blue curve). We then shift this curve to larger S_B values so that the horizontal part matches that of the 99.9%

Article number, page 6 of 12

R. Figuera Jaimes A. Arellano Ferro D.M. Bramich Sunetra Giridhar and K.Kuppuswamy: Variables in NGC 7492.

percentile (solid red curve). Finally we adopt the solid red curve as our detection threshold for new variables.

By choosing a variable star detection threshold set to the 99.9% percentile of S_B from our simulations of light curves that have only pure Gaussian noise, we have set our false alarm rate to 0.1%, which implies that with 1585 stars with combined VR light curves we should expect only ∼1.6 non-variable stars to fall above our threshold. However, since we are fully aware that the systematic errors may affect some light curves more than others for various reasons (e.g. near a saturated star, cosmic ray hits, etc.) we must still exercise caution with all candidate variable stars that lie above our detection threshold in S_B. We observe that for stars fainter than V =20.6 mag, the S_B values have a larger number of high outliers than is typical and therefore we further limit our variable star search to stars brighter than V =20.6 mag (vertical dashed red line in Fig. 6). We note that the two RR Lyrae stars V1 and V2 have S_B values much greater than our adopted detection threshold and are therefore recovered by this method.

We have explored the appearance of the light curves of all stars with S_B above our detection threshold and we have found convincing indications of variability in two stars in the blue straggler region. These SX Phe stars are discussed in Section 6 along with one other candidate SX Phe star that also lies above our detection threshold in S_B. The remaining stars with S_B values above our threshold do not show convincing light curve variability either on inspection of their light curves or when analysed with the string-length minimisation approach.

If we compare this method with the others used in this paper for detecting variable stars (see sec. 3.1, 3.2), then it becomes clear that this method is the only one that has been used to successfully detect all of the previously known and new variables in this cluster.

4. The RR Lyrae stars

Of the three known RR Lyrae stars in the cluster, the RR1 star V3 is not in the field of our images.

V1. This is a clear fundamental mode pulsator or RR0. Our data are neatly phased with a period of 0.805012 d (Fig 7). The light curve was fitted with 4 Fourier harmonics (red continuous line in Fig. 7) of the form of eq. 5.

m(t) = A_o + N� k=1 A_k cos ( 2π P k (t − E) + ϕ_k). (5)

We noted that using more than four harmonics results in over-fitting. The decomposition of the light curve in Fourier harmonics was used to estimate the iron abundance [Fe/H] and the absolute magnitude M_V , and hence the distance. These calculations were made using the semi-empirical calibrations available in the literature.

To calculate [Fe/H] we employed the calibration of Jurcsik & Kovács (1996) valid for RR0 stars.

[Fe/H]_J = −5.038 − 5.394 P + 1.345 ϕ^{(s)}_{31} . (6)

The Fourier parameter ϕ^{(s)}_{31} comes from fitting a sine series to the light curve of star V1 rather than a cosine series as in eq. 5. However, the corresponding cosine parameter ϕ^{(c)}_{31} is related by ϕ^{(s)}_{31} = ϕ^{(c)}_{31} − π. The above equation gives [Fe/H]_J with a standard deviation from this calibration of 0.14 dex (Jurcsik 1998).

Fig. 7. Light curve of the RR0 star V1 in the V filter (top) and the R filter (bottom) phased with the period 0.805012 d. The data point colours represent the different epochs listed in table 5. The red line corresponds to the Fourier fit of equation 3 with four harmonics. The typical uncertainties in the V and R magnitudes are ∼0.007 and 0.005 mag, respectively.

The Jurcsik metallicity scale can be transformed to the Zinn & West (1984) scale [Fe/H]_{ZW} through the relation [Fe/H]_J = 1.43 [Fe/H]_{ZW} + 0.88 (Jurcsik 1995). We note that the deviation parameter Dm (Jurcsik & Kovács 1996) for this star when fitting higher order Fourier series is greater than the recommended value. Hence, our metallicity estimate should be treated with caution.

We also calculate the metallicity on the UVES scale using the equation of Carretta et al. (2009):

[Fe/H]_{UVES} = −0.413 + 0.130[Fe/H]_{ZW} − 0.356[Fe/H]^2_{ZW}. (7)

From our light curve fit, we find ϕ^{(c)}_{31} =8.987 and obtain [Fe/H]_{ZW} = −1.68±0.10 or [Fe/H]_{UVES} =-1.64±0.13. These metallicity values are in good agreement with the mean spectroscopic values of [Fe/H]=-1.82±0.05 and [Fe/H]=-1.79±0.06 determined by Cohen & Melendez (2005) from Fe I and Fe II lines, respectively, in four bright red giants in the cluster. The Fe abundances were derived using high resolution (R=λ/δλ=35,000) spectra obtained with HIRES at the Keck Observatory. Similarly they are in good agreement with the latest spectroscopic metallicities from Saviane et al. (2012) (see table 4).

Other metallicity estimates for this cluster are [Fe/H]=- 1.70±0.06 from Rutledge et al. (1997) determined using moderate dispersion spectroscopy in the region of the infrared Ca triplet, [Fe/H]=-1.5±0.3 from Zinn & West (1984) using the narrow band Q39 photometric system, and [Fe/H]=-1.34±0.25 by Smith (1984) using the ΔS method for two RR Lyraes in the cluster. Thus the metallicity estimated via the Fourier decomposition technique agrees well with the other independent estimates (see table 4).

Article number, page 7 of 12

Table 4. Metallicity estimates for NGC 7492 on the ZW scale and their respective values on the UVES scale and vice versa as found from the literature search.

[Fe/H]_{ZW} [Fe/H]_{UVES} Reference Method -1.68±0.10 -1.64±0.13^c This work Fourier light-curve decomposition of the RR Lyrae stars -1.72±0.07 Saviane et al. (2012) Ca_{II} triplet using the FORS2 imager and spectrograph at the VLT -1.69±0.08 Saviane et al. (2012) Ca_{II} triplet using the FORS2 imager and spectrograph at the VLT -1.69±0.08 Carretta et al. (2009) Weighted average of several metallicities^b -1.82±0.05 -1.83±0.07^c Cohen & Melendez (2005) Fe_I line in bright red giants in this cluster -1.79±0.06 -1.79±0.08^c Cohen & Melendez (2005) Fe_{II} line in bright red giants in this cluster -1.70±0.06 -1.66±0.08^c Rutledge et al. (1997) Infrared Ca triplet -1.78 Harris (1996) Globular cluster catalogue^a -1.5±0.3 -1.41±0.36^c Zinn & West (1984) Narrow band Q39 photometric system -1.34±0.25 -1.23±0.27^c Smith (1984) ΔS method for two RR Lyraes in the cluster

Notes.^{(a)} The catalogue version used is the updated 2010 version available at http://www.physics.mcmaster.ca/Globular.html.^{(b)} Carretta et al. (2009), Carretta & Gratton (1997), Kraft & Ivans (2003), and the recalibration of the Q39 and W^{′′} indices.^{(c)} Converted from column 1 using Eq. 7 (Carretta et al. 2009).

For the determination of the absolute magnitude of V1 we employed the calibration of Kovács & Walker (2001),

M_V = −1.876 log P − 1.158 A_1 + 0.821 A_3 + K, (8)

which has a standard deviation of 0.04 mag. From our fit of equation 5 to the light curve of V1, we derive A_1=0.206 and A_3=0.034 mag. We adopt K=0.41 mag in order to be consistent with a true distance modulus for the Large Magellanic Cloud (LMC) of μ_0=18.5 mag (see the discussion in Arellano Ferro et al. 2010, in their section 4.2). We obtain M_V =0.376±0.040 mag which is equivalent to the luminosity log(L/L_⊙) =1.762±0.016. Assuming E(B − V) =0.0 mag (Harris 1996), the true distance modulus is μ_0 =16.927±0.040 mag, equivalent to a distance of 24.3 ± 0.5 kpc. Côté et al. (1991) estimated a distance of 26.18±2.41 kpc to NGC 7492 using the cluster NGC 6752 as a reference and whose distance was estimated by Penny & Dickens (1986). Our distance estimate using V1 agrees within the uncertainties.

V2. This RR1 star shows a complex light curve. The period derived by Barnes (1968) of 0.292045 d fails to phase our light curve properly. Using the string-length minimisation method on our light curve, we determine a period of 0.411764 d, which produces the phased light curve shown in Fig. 8. The period is towards the upper limit for an RR1 type star. However, long periods like this are not uncommon in Oosterhoff type II clusters, which typically have similar metallicity and horizontal branch morphology as NGC 7492 (Lee 1990; Clement et al. 2001). We note that our light curve does not phase well at this period and so we searched for a second period. As the ratio P_1/P_0 =0.746±0.001 (Catelan 2009; Cox et al. 1983) in RRd stars, then we expect the second period to be ∼0.5519 d when performing a search of the residuals from the first period. We could only find a non-significant second period with P_1=0.4365 d. The light curve shows nightly amplitude changes that resemble those found by Arellano Ferro et al. (2012) in the majority of RR1 stars in NGC 5024.

We have attempted to model the light curve with a secular period change which we have parameterised as in Bramich et al. (2011), i.e.

ϕ(t) = t − E P(t) − � t − E P(t) � (9)

Fig. 8. Light curve of the RR1 star V2 in the V filter (top) and the R filter (bottom) phased with the period 0.411764 d. The data point colours represent the different epochs listed in table 5. The typical uncertainties in the V and R magnitudes are ∼0.007 and 0.005 mag, respectively.

P(t) = P_0 + β(t − E), (10)

where ϕ(t) is the phase at time t, P(t) is the period at time t, P_0 is the period at the epoch E, and β is the rate of period change. We searched the parameter space at fixed epoch E, whose value is arbitrary, for the best-fitting values of P_0 and β, using as a criterion the minimum string-length statistic of the light curve. The search is done in a small range of periods around the previously determined best-fitting period. This is the only type of period change that we can consider modelling given our limited photometric data.

We found a period of P_0 = 0.412119 d at the epoch E =2453284.2652 d and a period change rate of β ≈47 d Myr^{−1}. The light curve phased with ϕ(t) from eq. 9 is shown in Fig.

Article number, page 8 of 12

R. Figuera Jaimes A. Arellano Ferro D.M. Bramich Sunetra Giridhar and K.Kuppuswamy: Variables in NGC 7492.

Fig. 9. Same as figure 8 except that now the light curve of V2 is phased with the period P_0=0.412119 d at the epoch E =2453284.2652 d with an ephemeris that includes a period change rate β ≈47 d Myr^{−1}.

Table 5. The data point colours used to mark different observing runs in figs 7, 8, 9, 11 and 12.

Dates Colour 20041004 - 20041005 Black

20060801 Red 20070804 - 20070805 Blue 20070904 - 20070905 Cyan 20090107 - 20090108 Magenta 20120628 - 20120629 Green

9. Clearly the phased light curve is now much improved, but we still observe possible amplitude modulations, which may be due to the Blazhko effect. This period change rate is higher than other values found in the literature by a factor of two or more (Le Borgne et al. 2007; Lee 1991; Jurcsik et al. 2001), but given our limited data we cannot speculate on the cause.

5. Long period variables

V4. This red giant variable, discovered by Barnes (1968), clearly stands out as a variable in Figs. 3 and 4. Barnes (1968) estimated a period of 17.9 days but pointed out that the observations did not cover the whole period. Our data set for this star consists of 119 V filter epochs distributed over a baseline of 8 years (top panel of Fig. 10). Thus our data are less than ideal for estimating an accurate period. Nevertheless, using the Period04 program (Lenz & Breger 2005), we find a period of ∼21.7 d. In the V vs (V-I) diagram (not plotted in the paper), the star is situated in the upper region of the red giant branch. Exploring the Catalogue of Variable Stars in Galactic Globular Clusters (Clement et al. 2001) one finds LBs (slow irregular variables of types K, M, C and S; see the General Catalog of Variable Stars (Kholopov et al. 1996) for classifications of variables) with periods of 13- 20 d and amplitudes 0.1-0.4 mag. See for example V8 and V10 in NGC 2419. See also, V109 in NGC 5024 listed as a semiregular variable with a period of 21.93 d and amplitude of 0.05 mag. Our data for V4 are consistent with the classification as a long period variable.

V5. From Figs. 3 and 4 we discover this new long period variable. Its light curve is shown in the bottom panel of Fig. 10. This star is saturated in our R and I images and hence we have not been able to plot it in the CMD and determine its classification (e.g. as a red giant). It is evident from the light curve that the star undergoes a long term dimming.

We note that for both V4 and V5, the formal uncertainties on the data points are typically ∼0.001 mag. However, these stars are very bright and their light curves suffer from systematic errors that correlate during the nightly observations, leading to a relatively large intra-night scatter (see Fig. 10).

Fig. 10. Light curves of the variables V4 and V5 in the V filter.

6. SX Phoenicis stars and candidates

We have discovered two new SX Phe stars which we label V6 and V7, and one candidate SX Phe star which we label CSX1.

V6. This variable was found above our detection threshold for the S_B statistic in section 3.4 (see figure 6). In the CMD it is placed well inside the blue straggler region (see figure 5). In fact, this star is a blue straggler as found by Côté et al. (1991). We analysed the V light curve with Period04 and found a clear frequency at 17.683477 cycles d^{−1} (or a period of 0.0565500 d). We did not find any further significant frequencies. Based on the blue straggler status and the detected period, we can be sure that this is an SX Phe star.

In figure 11, we present the phased light curve in the V and R filters. We overplot the best fit sine curve as a solid black line. As expected, the R filter light curve shows variations with the same period and phase as the V filter light curve but with smaller amplitude. There is a hint that the amplitude of V6 changed between different observing runs (compare the black points from 2004 with the green points from 2012). There are previous stud-

Article number, page 9 of 12 ies about SX Phe stars that show period change and also amplitude change. See for example figure 25 and section 4.2 in Nemec et al. (1995) and also section 5.2 in Arellano Ferro et al. (2010).

SX Phe stars are well known as distance indicators through their P-L relation (e.g. Jeon et al. 2003). By adopting the P-L relation for the fundamental mode recently calculated by Cohen & Sarajedini (2012) for a sample of 77 double mode SX Phe stars in Galactic globular clusters, which is of the form M_V = −1.640(±0.110) − 3.389(±0.090) log(P_f ), we may calculate M_V =2.588±0.157 mag for V6 assuming that it is pulsating in the fundamental mode. Given this, and assuming E(B − V) =0.0 mag, we obtain a true distance modulus μ_0 =16.644±0.157 mag, which translates to a distance of ∼21.3±1.5 kpc. Hence, if V6 is pulsating in the fundamental mode, it cannot be a cluster member.

However, if we assume that V6 is pulsating in the first overtone (1H), then we may “fundamentalise” the detected frequency by multiplying it by the frequency ratio f_1/ f_2 =0.783 (see Santolamazza et al. 2001; Jeon et al. 2003; Poretti et al. 2005). Using the Cohen & Sarajedini (2012) P-L relation as before, we obtain M_V =2.228±0.149 mag, μ_0 =17.004±0.149 mag, and a distance of ∼25.2±1.8 kpc. Hence, if V6 is pulsating in the first overtone, then it is most likely a cluster member.

Unfortunately, without detecting two frequencies in the light curve of V6, we cannot further speculate on the pulsation mode of this star.

V7. Again, this variable was found above our detection threshold for the S_B statistic. In the CMD, it lies on the RGB at the edge of the blue straggler region. We analysed the V light curve with Period04 and found a candidate frequency at 13.776775 cycles d^{−1} (or a period of 0.072586 d). We did not find any further significant frequencies.

In figure 12, we present the phased light curve in the V and R filters along with the best fit sine curve in V (solid black curve). The variations at an amplitude of ∼0.05 mag are barely visible in the phased V light curve. In order to quantify our classification of V7 as a variable with the detected period, we calculate the improvement in chi-squared Δχ^2 when fitting the sine curve compared to a constant magnitude. Under the null hypothesis that the light curve is not variable, the Δχ^2 statistic follows a chi-squared distribution with two degrees of freedom. We set our threshold for rejection of the null hypothesis at 1%, which is equivalent to Δχ^2 >∼ 9.21. The V light curve of V7 has Δχ^2 ≈ 14.40 which supports our conclusion that it is variable. We note that in the R filter, the light curve is not detected as showing variability by the Δχ^2 test.

Using the Cohen & Sarajedini (2012) P-L relation for the detected frequency, we obtain M_V =2.221±0.152 mag, μ_0 =17.142±0.152 mag, and a distance of ∼26.8±1.8 kpc, which is consistent with the distance to the cluster. Considering all the evidence we have discussed, we classify this star as an SX Phe star that is most likely a cluster member pulsating in the fundamental mode.

CSX1. This star was detected above the threshold for the S_B statistic, and it lies in the blue straggler region in the CMD. We searched for frequencies in the V light curve using period04, but we found no clear peaks. However, on our inspection of the light curve on individual nights, we found clear cyclical variations on the time scale of ∼1 hour (see figure 13). Since we have been unable to detect a pulsation frequency, we classify this star as a candidate SX Phe for which follow-up observations would be desirable.

Periods and amplitudes for the two new SX Phe and one candidate are given in Table 6. They are also labelled in the CMD

Fig. 11. Light curve of the newly discovered SX Phe star V6 in the V filter (top) and R filter (bottom) phased with the period 0.0565500 d. The data point colours represent the different epochs listed in Table 5. The solid black curves represent the best fit sine curves at the phasing period. The typical uncertainties in the V and R magnitudes are ∼0.02 mag.

Fig. 12. Light curve of the newly discovered SX Phe star V7 in the V filter (top) and R filter (bottom) phased with the period 0.0725859 d. The data point colours represent the different epochs listed in Table 5. The solid black curve represent the best fit sine curve at the phasing period in the V filter. The typical uncertainties in the V and R magnitudes are ∼0.02 mag.

Article number, page 10 of 12

R. Figuera Jaimes A. Arellano Ferro D.M. Bramich Sunetra Giridhar and K.Kuppuswamy: Variables in NGC 7492.

Fig. 13. Light curve of the candidate SX Phe star CSX1. Black points correspond to the V magnitudes and red points correspond to the R magnitudes (which are shifted in mean magnitude to match the mean magnitude of the V data). Some data points fall outside of the plot magnitude range.

Table 6. Detected pulsation frequencies for the new SX Phe variables discovered in NGC 7492. The numbers in parenthesis indicate the uncertainty on the last decimal place.

ID A_0^a Label Frequency A_V^b mode (V mag) (c/d^{−1}) (mag) V6 19.235(4) f_1 17.683477(13) 0.123(10) 1H?^c V7 19.363(4) f_1 13.776775(32) 0.030(10) F?^c

Notes.^{(a)} Mean V magnitude A_0^{(b)} Full amplitude A_V in the V filter^{(c)} If we assume that these stars are cluster members, then they are likely to be pulsating in the suggested mode.

of Fig. 5 and their equatorial coordinates (J2000) are listed in the Table 2. We note that the (V-R) colours of V6 and V7, converted to (B-V) using the colour transformations of Vanden- Berg & Clem (2003), are consistent (within 1σ) with the (B-V) colour-period relation of McNamara (2011).

7. Conclusions

Precise time series differential CCD V, R, I photometry with a baseline of ∼8 years has been performed to detect brightness variations in stars with 14.0 < V < 19.5 mag in the field of NGC 7492. We found the following:

1. We identified one new long period variable (V5) and two SX Phe stars (V6 and V7). We present one candidate SX Phe (CSX1), which requires more data of high precision to finally establish its nature.

2. With the S_B variability statistic, it was possible to recover all previously known variables and also to find the new variables presented in this work.

3. Our photometric precision at the magnitude of the horizontal branch combined with the consideration of the CMD means that we can be sure that there are no undetected RR Lyrae stars that are cluster members in the field of view of our images.

4. For the RR0 V1, we improve the period estimate and perform a Fourier analysis to estimate a cluster metallicity of [Fe/H]_{ZW} =-1.68±0.10 or [Fe/H]_{UVES} =-1.64±0.13 and a distance of ∼24.3±0.5 kpc.

5. We found that the RR1 star V2 is undergoing a period change at a rate of β ≈47 d Myr^{−1}. We also found tentative evidence for the presence of the Blazhko effect in the light curve.

6. By assuming that the SX Phe stars are cluster members (which is consistent with their position in the CMD), we have used the SX Phe P-L relation to speculate on the mode of oscillation of each star. We also obtain independent distance estimates to the cluster of ∼25.2±1.8 and 26.8±1.8 kpc.

7. The cluster metallicity and distance estimates that we derive in this paper are all consistent with previous estimates in the literature.

Acknowledgements. AAF acknowledges financial support from DGAPA- UNAM grant through project IN104612. We are thankful to the CONA- CyT (México) and the Department of Science and Technology (India) for financial support under the Indo-Mexican collaborative project DST/INT/MEXICO/RP001/2001. We thank the staff at IAO and at the remote control station at CREST, Hosakote for assistance during the observations. This work has made a large use of the SIMBAD and ADS services, for which we are thankful.

Article number, page 11 of 12

References

Arellano Ferro, A., Arévalo, M. J., Lázaro, C., et al. 2004, RMXAA, 40, 209 Arellano Ferro, A., Bramich, D. M., Figuera Jaimes, R., Giridhar, S., & Kuppuswamy, K. 2012, MNRAS, 420, 1333 Arellano Ferro, A., Figuera Jaimes, R., Giridhar, S., et al. 2011, MNRAS, 416, 2265 Arellano Ferro, A., García Lugo, G., & Rosenzweig, P. 2006, RMXAA, 42, 75 Arellano Ferro, A., Giridhar, S., & Bramich, D. M. 2010, MNRAS, 402, 226 Barnes, S. A. 1968, AJ, 73, 579 Bramich, D. M. 2008, MNRAS, 386, L77 Bramich, D. M., Arellano Ferro, A., Jaimes, R. F., & Giridhar, S. 2012, MNRAS, 424, 2722 Bramich, D. M., Figuera Jaimes, R., Giridhar, S., & Arellano Ferro, A. 2011, MNRAS, 413, 1275 Bramich, D. M., Horne, K., Albrow, M. D., et al. 2013, MNRAS, 428, 2275 Buonanno, R., Corsi, C. E., Ferraro, I., & Fusi Pecci, F. 1987, A&AS, 67, 327 Burke, Jr., E. W., Rolland, W. W., & Boy, W. R. 1970, JRASC, 64, 353 Carretta, E., Bragaglia, A., Gratton, R., D’Orazi, V., & Lucatello, S. 2009, A&A, 508, 695 Carretta, E. & Gratton, R. G. 1997, A&AS, 121, 95 Catelan, M. 2009, Ap&SS, 320, 261 Clement, C. M., Muzzin, A., Dufton, Q., et al. 2001, AJ, 122, 2587 Cohen, J. G. & Melendez, J. 2005, AJ, 129, 1607 Cohen, R. E. & Sarajedini, A. 2012, MNRAS, 419, 342 Corwin, T. M., Sumerel, A. N., Pritzl, B. J., et al. 2006, AJ, 132, 1014 Côté, P., Richer, H. B., & Fahlman, G. G. 1991, AJ, 102, 1358 Cox, A. N., Hodson, S. W., & Clancy, S. P. 1983, ApJ, 266, 94 Draper, P. W. 2000, in Astronomical Society of the Pacific Conference Series, Vol. 216, Astronomical Data Analysis Software and Systems IX, ed. N. Manset, C. Veillet, & D. Crabtree, 615 Dworetsky, M. M. 1983, MNRAS, 203, 917 Harris, W. E. 1996, VizieR Online Data Catalog, 7195, 0 Jeon, Y.-B., Lee, M. G., Kim, S.-L., & Lee, H. 2003, AJ, 125, 3165 Jurcsik, J. 1995, Acta Astron., 45, 653 Jurcsik, J. 1998, A&A, 333, 571 Jurcsik, J., Clement, C., Geyer, E. H., & Domsa, I. 2001, AJ, 121, 951 Jurcsik, J. & Kovács, G. 1996, A&A, 312, 111 Kains, N., Bramich, D. M., Figuera Jaimes, R., et al. 2012, A&A, 548, A92 Kholopov, P. N., Samus’, N. N., Frolov, M. S., et al. 1996, VizieR Online Data Catalog, 2139, 0 Kovács, G. & Walker, A. R. 2001, A&A, 371, 579 Kraft, R. P. & Ivans, I. I. 2003, PASP, 115, 143 Landolt, A. U. 1992, AJ, 104, 340 Le Borgne, J. F., Paschke, A., Vandenbroere, J., et al. 2007, A&A, 476, 307 Lee, Y.-W. 1990, ApJ, 363, 159 Lee, Y.-W. 1991, ApJ, 367, 524 Lenz, P. & Breger, M. 2005, Communications in Asteroseismology, 146, 53 McNamara, D. H. 2011, AJ, 142, 110 Nemec, J. M., Mateo, M., Burke, M., & Olszewski, E. W. 1995, AJ, 110, 1186 Penny, A. J. & Dickens, R. J. 1986, MNRAS, 220, 845 Poretti, E., Suárez, J. C., Niarchos, P. G., et al. 2005, A&A, 440, 1097 Rutledge, G. A., Hesser, J. E., & Stetson, P. B. 1997, PASP, 109, 907 Safonova, M. & Stalin, C. S. 2011, AJ, 142, 179 Santolamazza, P., Marconi, M., Bono, G., et al. 2001, ApJ, 554, 1124 Saviane, I., da Costa, G. S., Held, E. V., et al. 2012, A&A, 540, A27 Shapley, H. 1920, ApJ, 52, 73 Smith, H. A. 1984, ApJ, 281, 148 Stetson, P. B. 2000, PASP, 112, 925 Strader, J., Everitt, H. O., & Danford, S. 2002, MNRAS, 335, 621 Tamuz, O., Mazeh, T., & North, P. 2006, MNRAS, 367, 1521 VandenBerg, D. A. & Clem, J. L. 2003, AJ, 126, 778 Zacharias, N., Finch, C., Girard, T., et al. 2010, AJ, 139, 2184 Zinn, R. & West, M. J. 1984, ApJS, 55, 45

Article number, page 12 of 12