arXiv:1302.3093v1 [astro-ph.EP] 13 Feb 2013

Astronomy & Astrophysics manuscript no. hip11952final © ESO 2013 February 14, 2013

The GAPS Programme with HARPS-N@TNG II: No giant planets around the metal-poor star HIP 11952^⋆

S. Desidera^1, A. Sozzetti^2, A.S. Bonomo^2, R. Gratton^1, E. Poretti^3, R. Claudi^1, D.W. Latham^4, L. Affer^5, R. Cosentino^{6,7}, M. Damasso^{8,9,2}, M. Esposito^{10,11}, P. Giacobbe^{12,2}, L. Malavolta^{8,13}, V. Nascimbeni^{8,1}, G. Piotto^{8,1}, M. Rainer^3, M. Scardia^3, V.S. Schmid^{14}, A.F. Lanza^6, G. Micela^5, I. Pagano^6, L. Bedin^1, K. Biazzo^{15}, F. Borsa^{3,16}, E. Carolo^1, E. Covino^{15}, F. Faedi^{17}, G. Hébrard^{18}, C. Lovis^{13}, A. Maggio^5, L. Mancini^{19}, F. Marzari^{20,1}, S. Messina^6, E. Molinari^{7,21}, U. Munari^1, F. Pepe^{13}, N. Santos^{22,23}, G. Scandariato^6, E. Shkolnik^{24}, J. Southworth^{25}

1 INAF – Osservatorio Astronomico di Padova, Vicolo dell’Osservatorio 5, I-35122, Padova, Italy 2 INAF – Osservatorio Astrofisico di Torino, Via Osservatorio 20, I-10025, Pino Torinese, Italy 3 INAF – Osservatorio Astronomico di Brera, Via E. Bianchi 46, I-23807 Merate (LC), Italy, 4 Harvard-Smithsonian Center for Astrophysics, 60 Garden Street, Cambridge, MA 02138 5 INAF – Osservatorio Astronomico di Palermo, Piazza del Parlamento, Italy 1, I-90134, Palermo, Italy 6 INAF – Osservatorio Astrofisico di Catania, Via S.Sofia 78, I-9512, Catania, Italy 7 Fundación Galileo Galilei - INAF, Rambla José Ana Fernndez Pérez, 7 38712 Breña Baja, TF - Spain 8 Dip. di Fisica e Astronomia Galileo Galilei – Università di Padova, Vicolo dell’Osservatorio 2, I-35122, Padova, Italy 9 Osservatorio Astronomico della Regione Autonoma Valle d’Aosta, Fraz. Lignan 39, 11020, Nus (Aosta), Italy 10 Instituto de Astrofisica de Canarias, C/Via Lactea S/N, E-38200 La Laguna, Tenerife, Spain 11 Departamento de Astrofisica, Universidad de La Laguna, E-38205 La Laguna, Tenerife, Spain 12 Dipartimento di Fisica, Università di Trieste, Via Tiepolo 11, I-34143 Trieste, Italy 13 Observatoire Astronomique de l’Université de Geneve, 51 ch. des Maillettes - Sauverny, 1290, Versoix, Switzerland 14 Instituut voor Sterrenkunde, K.U. Leuven, Celestijnenlaan 200D, 3001 Leuven, Belgium 15 INAF – Osservatorio Astronomico di Capodimonte, Salita Moiariello 16, I-80131, Napoli, Italy 16 Dipartimento di Scienza e Alta Tecnologia, Università dell’Insubria, Via Valleggio 11, 22100 Como, Italy 17 Department of Physics, University of Warwick, Gibbet Hill Road, Coventry, CV4 7AL, UK 18 Institut d’Astrophysique de Paris, UMR7095 CNRS, Univ. P. & M. Curie, 98bis bd. Arago, F-75014 Paris, France 19 Max-Planck-Institut für Astronomie, Königstuhl 17, D-69117, Heidelberg, Germany 20 Dipartimento di Fisica e Astronomia Galileo Galilei – Università di Padova, Via Marzolo 8, Padova, Italy 21 INAF - IASF Milano, via Bassini 15, I-20133 Milano, Italy 22 Centro de Astrofísica, Universidade do Porto, Rua das Estrelas, 4150-762 Porto, Portugal 23 Departamento de Física e Astronomia, Faculdade de Ciências, Universidade do Porto, Portugal 24 Lowell Observatory, 1400 W. Mars Hill Road, Flagstaff, AZ 86001, USA 25 Astrophysics Group, Keele University, Staffordshire, ST5 5BG, UK

Received / Accepted

ABSTRACT

In the context of the program Global Architecture of Planetary Systems (GAPS), we have performed radial velocity monitoring of the metal-poor star HIP 11952 on 35 nights over about 150 days using the newly installed high resolution spectrograph HARPS-N at the TNG and HARPS at ESO 3.6m telescope. The radial velocities show a scatter of 7 m s^{−1}, compatible with the measurement errors for such a moderately warm metal-poor star (T_{eff} = 6040 ± 120 K; [Fe/H] = −1.9 ± 0.1). We then exclude the presence of the two giant planets with periods of 6.95 ± 0.01 d and 290.0 ± 16.2 d and radial velocity semi-amplitudes of 100.3 ± 19.4 m s^{−1} and 105.2 ± 14.7 m s^{−1}, respectively, which had recently been announced. This result is important considering that HIP 11952 was thought to be the most metal-poor star hosting a planetary system with giant planets, thus challenging some models of planet formation.

Key words. (Stars:) individual: HIP 11952 — planetary systems — techniques: radial velocities

Send offprint requests to: S. Desidera ⋆ Based on observations made with the Italian Telescopio Nazionale Galileo (TNG) operated on the island of La Palma by the Fundacion Galileo Galilei of the INAF at the Spanish Observatorio del Roque de los Muchachos of the IAC in the frame of the program Global Architecture of Planetary Systems (GAPS). Based on observations collected at the La Silla Observatory, ESO (Chile): Program 185.D-0056.

1. Introduction

The identification of planets around stars with abundances of heavy element significantly lower than the Sun represents a relevant test for models of the formation of planetary systems. On the one hand, assuming stellar metallicity ([Fe/H]) to be a natural proxy for the actual heavy metal content of the primordial circumstellar disk, the core-accretion scenario for giant planet formation predicts

S. Desidera et al.: GAPS II: No giant planets around HIP 11952

that the planet frequency f_p should increase with higher [Fe/H] (Ida & Lin 2004; Mordasini et al. 2009a), as the increased surface density of solids facilitates the growth of embryonic cores, thus greatly enhancing the formation of gas giant planets around more metal-rich stars. Indeed, there exist theoretical expectations for threshold values of [Fe/H] below which giant planets cannot form, [Fe/H] ≃ −0.5 (Johnson & Li 2012; Mordasini et al. 2012). On the other hand, gas giant planet formation by gravitational instability is less sensitive to the disk metal content, thus f_p is expected to be independent of [Fe/H] (Boss 2002).

The observational evidence of a strong dependence of f_p on [Fe/H] for giant planets (Santos et al. 2004; Fischer & Valenti 2005) is commonly considered as supporting the core-accretion mechanism (Mordasini et al. 2009b). No significant trends of f_p with [Fe/H] are observed for low-mass planets (Neptunes and super-Earths) in radial-velocity (RV) surveys, for the metal abundance range −0.5 ≤[Fe/H]≤ +0.1 (Mayor et al. 2011; Sousa et al. 2011). This result was recently confirmed by statistical analyses of Kepler transiting planet candidates (Buchhave et al. 2012). Moreover, low-mass planets seem to be rare around super-metal-rich stars (Jenkins et al. 2012).

The f_p–[Fe/H] relation for giant planets is firmly established on a solid statistical basis for [Fe/H] > 0.0. In this regime, a simple power-law fit with α × 10^{β[Fe/H]}, and β in the range 1.5–2.0, well represents the observed trend (e.g Fischer & Valenti 2005; Sozzetti et al. 2009; Johnson et al. 2010). Stars with [Fe/H] ∼ +0.3 appear 4–5 times more likely to host a giant planet than solar-metallicity dwarfs. At [Fe/H] ≃ 0.0, f_p is in the neighbourhood of 3–5%. The situation is however less clear for [Fe/H] < 0.0, and recent studies (Mortier et al. 2012) indicate the possibility that a power law might not describe correctly the relation in the low-metallicity regime.

The uncertainties still apparent in statistical studies stem primarily from the relatively limited sample sizes of metal-poor stars in large RV surveys. Attempts at mitigating this limitation have been made in the past, with experiments focusing on RV searches for giant planets around about 250 metal-poor stars carried out by Sozzetti et al. (2006, 2009) with Keck/HIRES and Santos et al. (2011) using HARPS on the ESO 3.6m telescope. The outcome of the first survey was a null result, while the HARPS survey yielded three detections at the metal-rich end ([Fe/H] ∼ −0.5) of the sample (Santos et al. 2007, 2010). Another project started in June 2009 around a sample of 96 metalpoor stars with the FEROS spectrograph. Detections have been reported from this survey of a short-period (P = 16 d) giant planet around the metal-poor horizontal branch star HIP 13044 (Setiawan et al. 2010) and of a two-planet system orbiting the F dwarf HIP 11952 (Setiawan et al. 2012, hereafter S12).

The HIP 11952 system is of particular interest. The primary is a high-proper-motion, nearby (d = 112 pc), relatively bright (V = 9.85) early F-type dwarf (possibly a subgiant), with [Fe/H] = −1.9 ± 0.1 (S12). The two planets reported by S12 have P = 6.95 ± 0.01 d and and minimum masses m_2 sin i = 0.78 ± 0.16 M_J and 2.93 ± 0.42 M_J, respectively. The HIP 11952 system, with a metallicity ten times lower than the second-lowest metallicity giant-planet hosting dwarf, poses a severe challenge to the core-accretion model (Johnson & Li 2012; Mordasini et al. 2012).

HIP 11952 was included in our program focusing on known planetary systems within the framework of the long-term project Global Architecture of Planetary Systems (GAPS) recently started in open time using HARPS-N at the Telescopio Nazionale Galileo (TNG). A description of the program is provided in Covino et al. (A&A to be submitted). We aimed at a) improving the quality of the orbital solutions reported by S12, and b) looking for evidence of lower-mass companions. In this Letter, based on RV measurements with typical internal errors 5–10 times lower than the originally published FEROS values, we report a nondetection of both giant planets announced by S12.

2. HARPS-N

HARPS-N is an échelle spectrograph covering the visible wavelength range between 383 and 693 nm (Cosentino et al. 2012). It is a near-twin of the HARPS instrument mounted at the ESO 3.6-m telescope in La Silla (Mayor et al. 2003). It was installed at the TNG in spring 2012. After instrument commissioning in late spring and summer 2012, it was offered for open time programs starting in August 2012.

The instrument is located in a thermally-controlled room, within a vacuum-controlled enclosure to ensure the required stability, and is fed by two fibres at the Nasmyth B focus of the TNG. The second fibre can be used for simultaneous calibration (currently with a Th-Ar hollow-cathode lamp) or for monitoring of the sky depending on the science goal and target brightness. Both fibres have an aperture on the sky of 1 arcsec. The spectra are recorded on an E2V 4k4 CCD 231 with a 15 μm pixel size. The resulting sampling is about 3.3 pixels (FWHM) and the spectral resolution is about 115,000. Early observing tests yielded an instrument total efficiency of ε = 7% at 550 nm, including losses due to the Earth’s atmosphere and the telescope mirrors.

A failure of the red side of the CCD in late Sept 2012 caused the observations between Sept 29th and Oct 25th 2012 to be performed using the blue side only. A new CCD was installed at the beginning of November 2012, and observations after this date were performed with the full spectral range. The possible impact of the observations taken with only half of the spectral range is discussed in § 4.

3. Observations and data reduction

HIP 11952 was observed with HARPS-N on 25 nights from 2012 Aug 7 to 2013 Jan 6. The Th-Ar simultaneous calibration was used in all observations. The drift correction with respect to the reference calibration was almost always below 1 m s^{−1}. The integration time of 900 s adopted for all the observations led to a typical S/N ratio of ∼ 70–80 per pixel on the extracted spectrum at 460 nm. Additional observations on 14 nights in two runs from 2012 Dec 11 to 2013 Jan 5 were also gathered at the ESO 3.6m telescope using HARPS. An integration time of 1200 s was adopted.

RV measurements, and their internal errors, were obtained using the online pipelines of HARPS and HARPS- N, which are based on the weighted cross-correlation function (CCF) method (Baranne et al. 1996; Pepe et al. 2002). The G2 mask was adopted (the earliest-type one available). The median of the internal errors is σ_{RV} = 5.8 m s^{−1} for HARPS-N (full CCDs in use) and σ_{RV} = 5.6 m s^{−1} for HARPS. The relatively large RV errors are due to the

S. Desidera et al.: GAPS II: No giant planets around HIP 11952

paucity of spectral lines of such a moderately warm, metalpoor star. The HARPS-N spectra between JD 2456199 and 2456228 were acquired with only the spectral orders falling on the blue side of the CCD. Besides the increase of the RV uncertainties due to the lower number of lines (median σ_{RV} = 8.3 m s^{−1}), using only half of the spectral range also introduced a systematic RV zero-point shift, with possible additional shifts due to the slight change in dispersion and spectral resolution required for the optimisation of the échelle grating angle. We estimated such a shift by deriving the RVs of full-chip spectra including only the spectral orders on the blue side of the CCD, i.e. with λ < 534.75 nm. The average offset is 7.4 ± 0.9 m s^{−1}, the half-chip RVs being higher. Such a shift is consistent with RV differences observed for other stars in the GAPS program using the same mask. Additional offsets should also be present between the RVs obtained with HARPS and HARPS-N, as they cover slightly different spectral ranges, and possibly for the RVs taken with the new HARPS-N CCD since focus adjustments were made and chip properties may be different. However, from the available data, these offsets appear below the measurement uncertainties.

4. Analysis

The relative RV time series is shown in Fig. 1. We report in Table 1 the full dataset. We included the correction of +7.4 m s^{−1} for the half-chip RVs. We anticipate that, whilst this has an obvious impact when attempting to search for RV variations with an amplitude close to the measurement uncertainties or to investigate the existence of a long-term trend, the main result of the paper is entirely unaffected by this procedure. The RV measurement obtained on 2012 Nov 12 (the blue open circle at JD 2456244.5992 in the upper panel of Fig .1), immediately after operations were resumed with the new HARPS-N CCD in place, is not included in the analysis as it has discrepant values of CCF contrast and activity index, pointing to a temporary calibration problem with the new setup.

The offset-corrected scatter (6.9 m s^{−1}) is consistent with the internal errors. Considering our sampling, RV variations with periods and semi-amplitudes (∼ 100 m s^{−1}) close to those reported in Setiawan et al. (2012) are clearly ruled out. A Lomb-Scargle periodogram of the RVs does not indicate any significant periodicities in the range 2–400 days (Fig. 2). The confidence levels in Fig. 2 were obtained by random permutations as in Desidera et al. (2011).

Furthermore, there are neither significant periodicities nor correlations of the RVs with the CCF FWHM, the CCF contrast, and the bisector velocity span, as obtained by the instruments’ pipelines, as well as with the Ca II H&K activity indicator, measured as in Desidera et al. (2006). S12 also suggest that HIP 11952 could be a pulsating variable. This possibility would be of great relevance, since in this case the RV measurements should primarily show the effect of the pulsation. The power spectra of the Hipparcos and ASAS (All-Sky Automated Survey; Pojmanski 2002) photometric data are very noisy due to their poor spectral windows, but no significant periodic signal is detected.

Our RVs do not show significant long-term trends. To further constrain the existence of a stellar companion on a long-period orbit, we considered the 14 RVs obtained by Latham et al. (2002) with the CfA Digital Speedometers (DS) between 1984 and 1998. Typical errors are 0.7 km s^{−1}

Fig. 1. Relative RVs of HIP 11952 obtained with HARPS- N and HARPS. In the upper panel, green circles represent full-chip HARPS-N data, blue triangles blue-chip HARPS- N data and red squares HARPS data. An offset of −7.4 m/s was applied to the blue-chip data. The open green circle is not included in the analysis. In the lower panel the predicted RV signature of the two planets by S12 is overplotted as a solid line.

and no obvious trend in the RVs over that time span is apparent. Furthermore, Latham (private communication) obtained five new RVs with the Tillinghast Reflector Echelle Spectrograph (TRES) at the FLWO observatory over a span of eight nights during December 2012 with typical errors of 0.1 km s^{−1}. The average velocity for these RVs, when shifted to the velocity zero point of the CfA DS (determined from extensive observations of standard stars), is 23.90 ± 0.05 km s^{−1} (uncertainty of the mean), compared to 23.64 ± 0.25 km s^{−1} for the 14 old RVs from the CfA DS. The probability that the star has a constant velocity, given the internal errors of the 19 observations, is P(χ^2) = 0.47. Thus there is no evidence for a secular drift in the velocities of HIP 11952 over a span of 29 years.

Following Sozzetti et al. (2009), upper limits on the minimum mass of possible planetary companions with 3 ≤ P ≤ 350 days and eccentricity e < 0.6 were derived from our data with 99% confidence level, based on the F-test and χ^2 statistics (Fig. 3). They show that both the inner and outer planets claimed by S12 are ruled out by our observations, at the 6-σ and 4-σ level, respectively. Actually, this test excludes at the given level of confidence any planet with masses and periods as given by S12, whatever their orbital parameters. Planets with masses, periods and other

S. Desidera et al.: GAPS II: No giant planets around HIP 11952

Fig. 2. Lomb-Scargle periodogram of RVs of HIP 11952 obtained with HARPS-N and HARPS. Confidence levels from the bootstrap simulations are shown. The vertical dotted lines mark the periodicities identified by S12 based on FEROS RVs.

Fig. 3. Upper limits on the minimum mass of possible planetary companions around HIP 11952 with 99% confidence level from HARPS-N and HARPS data. Filled circles show the mass and period of the two planets claimed by S12 that are clearly incompatible with our data.

orbital parameters as given by S12 are excluded at higher levels of confidence by our data.

5. Discussion and conclusions

Based on high-precision RV measurements carried out with HARPS-N and HARPS we found no evidence of the two giant planets with P = 6.95 d and P = 290 d, and projected masses 0.78 ± 0.16 M_J and 2.93 ± 0.42 M_J , respectively, announced by S12 orbiting the metal-poor star HIP 11952. Saturn-mass and Jupiter-mass planets with periods shorter than 30 and 250 days, respectively, are also excluded. Our observations are within the measurement errors, that are about 5–10 times lower than those of the FEROS observations, thanks to the optimised performance of HARPS-N in delivering RVs and the larger telescope aperture. This case shows that care should be taken in interpreting RV variations as indicating orbital motion, as stellar and instrumental effects could impact the measurements, particularly when inferred RV amplitudes are only slightly larger than the measurement accuracy.

Our result has important consequences, as it clears the observational sample of a system that constituted a severe challenge to the core-accretion model of giant planet formation. A giant planet system around HIP 11952 was indeed very hard to explain within the context of the most recent calculations based on this mechanism (Johnson & Li 2012; Mordasini et al. 2012).

On the one hand, giant planets formed by core accretion are expected to be very rare around low-metallicity dwarfs, and the observational evidence presented here directly supports this view. On the other hand, low-mass planets can theoretically form around metal-poor stars, so it is highly desirable to obtain statistically useful observational inferences on the actual value of f_p for Super-Earths and Neptunes across orders of magnitude in the host stars’ metal content. New programs to search for low-mass planets around metal-poor stars (such as the on going ESO large program 190.C-0027 on HARPS and our dedicated GAPS program on HARPS-N) will then allow for a significant improvements in our knowledge of the relative roles of competing planet formation processes.

Acknowledgements. We thank the TNG staff for help in the preparation of the observations and R. Smareglia and collaborators for the kind assistance with the data retrieval from TNG archive. This work was partially funded by PRIN-INAF 2010. NCS acknowledges the support by the ERC/EC under the FP7 through Starting Grant agreement n. 239953, as well as the support from Fundação para a Ciência e a Tecnologia (FCT) through prog. Ciência 2007 funded by FCT/MCTES (Portugal) and POPH/FSE (EC), and in the form of grants ref. PTDC/CTE-AST/098528/2008 and PTDC/CTE- AST/120251/2010.

References

Baranne, A., Queloz, D., Mayor, M., et al. 1996, A&AS, 119, 373 Boss, A. P. 2002, ApJ, 567, L149 Buchhave, L. A., Latham, D. W., Johansen, A., et al. 2012, Nature, 486, 375 Cosentino, R., Lovis, C., Pepe, F., et al. 2012, in Society of Photo- Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 8446, Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series Desidera, S., Carolo, E., Gratton, R., et al. 2011, A&A, 533, A90 Desidera, S., Gratton, R. G., Lucatello, S., Claudi, R. U., & Dall, T. H. 2006, A&A, 454, 553 Fischer, D. A. & Valenti, J. 2005, ApJ, 622, 1102 Ida, S. & Lin, D. N. C. 2004, ApJ, 616, 567 Jenkins, J. S., Jones, H. R. A., Tuomi, M., et al. 2012, ArXiv e-prints Johnson, J. A., Aller, K. M., Howard, A. W., & Crepp, J. R. 2010, PASP, 122, 905 Johnson, J. L. & Li, H. 2012, ApJ, 751, 81 Latham, D. W., Stefanik, R. P., Torres, G., et al. 2002, AJ, 124, 1144 Mayor, M., Marmier, M., Lovis, C., et al. 2011, ArXiv e-prints Mayor, M., Pepe, F., Queloz, D., et al. 2003, The Messenger, 114, 20 Mordasini, C., Alibert, Y., & Benz, W. 2009a, A&A, 501, 1139 Mordasini, C., Alibert, Y., Benz, W., Klahr, H., & Henning, T. 2012, A&A, 541, A97 Mordasini, C., Alibert, Y., Benz, W., & Naef, D. 2009b, A&A, 501, 1161 Mortier, A., Santos, N. C., Sozzetti, A., et al. 2012, A&A, 543, A45 Pepe, F., Mayor, M., Galland, F., et al. 2002, A&A, 388, 632 Pojmanski, G. 2002, Acta Astron., 52, 397 Santos, N. C., Israelian, G., & Mayor, M. 2004, A&A, 415, 1153 Santos, N. C., Mayor, M., Benz, W., et al. 2010, A&A, 512, A47 Santos, N. C., Mayor, M., Bonfils, X., et al. 2011, A&A, 526, A112 Santos, N. C., Mayor, M., Bouchy, F., et al. 2007, A&A, 474, 647 Setiawan, J., Klement, R. J., Henning, T., et al. 2010, Science, 330, 1642 Setiawan, J., Roccatagliata, V., Fedele, D., et al. 2012, A&A, 540, A141

S. Desidera et al.: GAPS II: No giant planets around HIP 11952

Table 1. Radial velocities of HIP 11952. The last column indicates the instrument and CCD status: F is HARPS-N original full chip; H is HARPS-N half chip only (blue side); N is HARPS-N new chip; S is HARPS at ESO 3.6m. The tabulated RVs do not include any offset between the data obtained with different observational setups.

BJD -2450000 RV error Instrument/CCD (km s^{−1}) (km s^{−1})

6147.72121 24.2530 0.0050 F 6160.74007 24.2435 0.0070 F 6166.74103 24.2556 0.0058 F 6173.72276 24.2529 0.0059 F 6174.73851 24.2495 0.0049 F 6175.69620 24.2601 0.0056 F 6176.68467 24.2625 0.0053 F 6177.71773 24.2582 0.0059 F 6178.68027 24.2550 0.0058 F 6199.65825 24.2505 0.0074 H 6200.67111 24.2598 0.0063 H 6201.65011 24.2715 0.0066 H 6202.61782 24.2650 0.0084 H 6207.70025 24.2726 0.0098 H 6208.68055 24.2668 0.0151 H 6211.64234 24.2681 0.0082 H 6226.61110 24.2629 0.0175 H 6227.58001 24.2777 0.0066 H 6244.59921 24.2753 0.0090 N 6266.46650 24.2618 0.0051 N 6272.54203 24.2478 0.0070 S 6273.54629 24.2459 0.0054 S 6274.53914 24.2579 0.0054 S 6275.53456 24.2562 0.0059 S 6276.53597 24.2566 0.0056 S 6277.54178 24.2481 0.0055 S 6278.54057 24.2464 0.0056 S 6279.53845 24.2464 0.0052 S 6280.53859 24.2519 0.0080 S 6288.48127 24.2573 0.0109 N 6293.54512 24.2518 0.0051 S 6294.53344 24.2616 0.0050 S 6294.86975 24.2565 0.0081 N 6295.53899 24.2415 0.0055 S 6295.91839 24.2543 0.0064 N 6296.53505 24.2615 0.0062 S 6296.88798 24.2674 0.0046 N 6297.53385 24.2547 0.0071 S 6299.33693 24.2645 0.0060 N 6299.40581 24.2537 0.0057 N

Sousa, S. G., Santos, N. C., Israelian, G., Mayor, M., & Udry, S. 2011, A&A, 533, A141 Sozzetti, A., Torres, G., Latham, D. W., et al. 2006, ApJ, 649, 428 Sozzetti, A., Torres, G., Latham, D. W., et al. 2009, ApJ, 697, 544