arXiv:1206.0650v1 [quant-ph] 4 Jun 2012

On the relationship between pump chirp and single-photon chirp in spontaneous parametric downconversion

Xochitl Sanchez-Lozano^1, Alfred B. U’Ren^2, Jose Luis Lucio^1 1División de Ciencias e Ingenierías, Universidad de Guanajuato, P.O. Box E-143, 37150, León Gto., México.

2Instituto de Ciencias Nucleares, Universidad Nacional Autónoma de México, Apdo. Postal 70-543, México 04510 DF (Dated: December 3, 2020)

We study the chronocyclic character, i.e. the joint temporal and spectral properties, of the singlephoton constituents of photon pairs generated by spontaneous parametric down conversion. In particular we study how single photon properties, including purity and single-photon chirp, depend on photon pair properties, including the type of signal-idler spectral and correlations and the level of pump chirp.

PACS numbers: ..........42.50.-p, 03.65.Ud

I. INTRODUCTION

Single photons constitute the most fundamental building block of optical fields. Single photons are often described in terms of a single optical mode described by an annihilation operator â, i.e. as â^†|0⟩, where |0⟩ is the vacuum. However, single photons emitted through actual physical processes are of course wavepackets involving different optical frequencies as well as different directions of propagation. A complete understanding of single photons emitted under realistic conditions therefore requires an in-depth study of their multi-modal richness.

In this paper we concentrate our study on single photons derived from photon pairs emitted through the process of spontaneous parametric down conversion (SPDC) in second-order non-linear crystals. Likewise, we focus on the spectral degree of freedom in the SPDC photon pairs. The process of SPDC can be extremely versatile as the basis for photon-pair source design; indeed, a careful selection of the source configuration leads to the ability to widely select the properties of the emitted photon pairs. Thus, for example, photon pair sources exhibiting entanglement in discrete photonic degrees of freedom (such as polarization [1, 2] and orbital angular momentum [3]), and alternatively exhibiting entanglement in continuous degrees of freedom [4, 5] (such as frequency/time [6], transverse momentum/position [7]) have been demonstrated. In the specific case of the spectral degree of freedom, photon-pair sources have been designed and demonstrated with a large range of behaviors in terms of the emission bandwidth (ranging from tens of MHz [8] to hundreds of THz [9]) and in terms of the degree of the entanglement (ranging from factorable [10] to highly entangled [9]).

The detection of one of the two photons in a given SPDC pair, can herald the presence of its conjugate, an approach often used as the basis for single-photon sources [11, 12]. Heralded single photons have been characterized in previous works, for example through a measurement of the corresponding Wigner function in the phase space formed by the position and momentum electric field quadratures [13, 14]. In this paper we are primarily interested in studying how the spatial and temporal properties of the pump translate into specific properties of the constituent singles photons, in particular in the time-frequency degree of freedom. Indeed, in a recent work from our group, we have shown that pump chirp may be used in order to control effectively the degree of entanglement in SPDC photon pairs, and consequently control the purity of the constituent single photons [15]. We have shown that if the source is designed so that in the absence of pump chirp photon pairs are factorable, or equivalently so that the constituent single photons are pure [16], an arbitrary degree of photon-pair entanglement, or single-photon purity, can be attained by varying the level of pump chirp.

Besides the single-photon purity, in this paper we are also interested in the chronocyclic character, i.e. in the joint spectral-temporal properties, of the single photons. Specifically, we are interested in studying how the chronocyclic character of the pulse train associated with a broadband pump defines the chronocyclic character of the emitted single photons. While this is interesting from a fundamental-physics perspective, it is also important in the context of quantum information processing (QIP) applications which rely on single photons. Knowledge of the full multi-mode structure of single photons is essential for the correct design of specific QIP implementations. Indeed, an understanding of, and the ability to control these chronocyclic properties are crucial for the correct mode-matching of single photons to other photonic modes in interferometric arrangements. For example, both Hong-Ou-Mandel interference of single photons from distinct sources, and homodyning of single photons with a coherent state depend crucially on the singlephoton chronocyclic character. Therefore, it is important to understand how pump chirp, used as a tool for tailoring the level of spectral entanglement present in SPDC photon pairs, also determines the chronocyclic character of the single photons which constitute each pair.

An ideal framework in which to study the singlephoton joint spectral-temporal properties is the singlephoton Chronocyclic Wigner function (CWF). In this paper, we study the relationships between the single photon spectral density matrix, the first order degree of spectral and temporal coherence, and the single-photon CWF. We study in particular how the type of spectral correlations in the SPDC photon pairs, together with the level of pump chirp, determine on the one hand the purity and on the other hand the presence of spectral-temporal correlations, or chirp, in the single photons.

II. SPDC PHOTON PAIRS, AND THEIR CONSTITUENT SINGLE PHOTONS

In the spontaneous parametric downconversion process (SPDC) an optical crystal with a second-order nonlinearity is illuminated by a laser pump beam. Individual photons from the pump beam may then be annihilated, leading to the emission of photon pairs, where the two photons in a given pair are typically referred to as signal and idler. These photon pairs may be entangled in any of the photonic degrees of freedom, including polarization, time-frequency and transverse position-momentum. In this paper we concentrate on the spectral degree of freedom; specifically, we assume that appropriate spatial filtering on the signal and idler modes is used so that only specific directions of propagation are retained.

Following a standard perturbative approach, the twophoton state for the SPDC process can be written as |Ψ⟩ = |0⟩ + η|Ψ_2⟩, in terms of the two-photon component of the state |Ψ_2⟩

|Ψ_2⟩ = ∫ dω_s ∫ dω_if(ω_s, ω_i)|ω_s⟩|ω_i⟩, (1) where η is related to the conversion efficiency, f(ω_s, ω_i) is the joint spectral amplitude (JSA) function, |ω_μ⟩ = â^†_μ(ω)|0⟩ with μ = i, s, and |0⟩ represents the vacuum state.

The focus of this paper is on the properties of the single photons which constitute each of the SPDC pairs. Specifically, we are interested in studying how the singlephoton properties are determined by the photon-pair properties. Each of the single photons in a given pair is completely characterized by its respective density operator. For the specific case of the signal mode, the density operator ρ̂_s can be written as

ρ̂_s = Tr_i(|Ψ⟩⟨Ψ|), (2)

where Tr_i represents a partial trace over the idler mode. In terms of the JSA, the reduced density operator can be expressed through its matrix elements as

ρ_s(ω_1, ω_2) ≡ ⟨ω_1|ρ̂_s|ω_2⟩ (3) = ∫ dω_0f(ω_1, ω_0)f^∗(ω_2, ω_0).

The density matrix ρ_s(ω_1, ω_2) fully characterizes the signal-mode single photons. Note that the normalization condition on the density operator Tr(ρ̂_s) = 1 is equivalent to the normalization condition ∫ dω_s ∫ dω_i|f(ω_s, ω_i)|^2 = 1 for the JSA function. For what follows, it is convenient to write down the density matrix expressed in terms of diagonal ω and off-diagonal ω^′ frequency components, ρ^D (ω, ω^′), where ω and ω^′ are related to ω_1 and ω_2 through ω_1 = ω + ω^′/2 and ω_2 = ω − ω^′/2,

ρ^D_s (ω, ω^′) = ρ_s ( ω + ω^′ 2 , ω − ω^′ 2 ) . (4)

An important property of the single photons is their purity, quantified by

p ≡ Tr(ρ̂^2) = ∫ dω_1 ∫ dω_2|ρ_s(ω_1, ω_2)|^2. (5)

Aside from the purity, in this paper we are interested in the spectral and temporal properties of the single photons. The Wigner distribution function applied to the time-varying electric field provides a mathematical tool which can represent classical light pulses in chronocyclic, i.e. in time-frequency space [17]. This leads to a representation that shows intertwined temporal and spectral effects, aiding a better comprehension of certain optical phenomena. In the realm of quantum optics, it is convenient to study the temporal and spectral properties of single photons through the single-photon Chronocyclic Wigner function [18]. Indeed, while the density matrix contains complete information about the single photons, in this paper we also use the single-photon chronocyclic function (CWF) W (ω, t), because this leads to a better direct appreciation of the temporal, as well as spectral, properties of the single photons. In particular, phase information which is absent from the absolute value of the density matrix |ρ_s(ω_1, ω_2)|, appears naturally in the realvalued CWF. Certain spectral-temporal properties such as single-photon chirp become more directly apparent in the chronocyclic domain.

The density matrix ρ(ω_1, ω_2) and the chronocyclic Wigner function W (ω, t) are related to each other through a Fourier transform, as follows

W (ω, t) = 1 2π ∫ dω^′ρ^D_s (ω, ω^′) e^{−iω′ t}. (6) Or, conversely,

ρ^D_s (ω, ω^′) = ∫ dt W (ω, t)e^{iω′ t}. (7) It is known that integration of the CWF over the time variable yields the single-photon spectral intensity, or single-photon spectrum (SPS) I_ω (ω). Thus, we can show that the SPS is closely related to the diagonal elements of the density matrix, i.e.

I_ω(ω) ≡ ∫ dtW (ω, t) = ρ_s(ω, ω) = ρ^D_s (ω, 0). (8) The function ρ_s(ω, ω) is then related to the “population of each single-photon spectral component”, in other words to the relative spectral intensity at each of the spectral components. Normalization of I_ω(ω), so that ∫ dωI_ω (ω) = 1 is guaranteed by the normalization of the density matrix, i.e. Tr(ρ_s) = 1. The off-diagonal elements, or “coherences between different spectral components”, which occur for ω^′ ≠ 0, then can have non-zero values for pure states and vanish for highly impure states. In fact, the interpretation of the off-diagonal elements as coherences may be made direct by observing that there is a simple relationship between the first degree of spectral coherence S(ω_1, ω_2) between two frequencies ω_1 and ω_2 and the density matrix ρ(ω_1, ω_2). S(ω_1, ω_2) may be defined as follows [19]

S(ω_1, ω_2) ≡ Tr [ ρ̂_sa^†(ω_1)a(ω_2) ] . (9)

It is then a simple matter to show that

S(ω_1, ω_2) = ρ^∗(ω_1, ω_2). (10)

Alternatively, we may choose to study the coherence between two different times. In this case, we define the first degree of coherence Γ(t_1, t_2) between two different times t_1 and t_2. In terms of the time-domain annihilation operator ã(t) = ∫ dωa(ω)e^{−iωt}, Γ(t_1, t_2) may be defined as

Γ(t_1, t_2) ≡ Tr [ ρ̂_sã^†(t_1)ã(t_2) ] . (11)

It can then be shown that Γ(t_1, t_2) may be expressed in terms of the density matrix ρ^D(ω, ω^′) as

Γ(t_1, t_2) = ∫ dω ∫ dω^′ρ^D(ω, ω^′)e^{−i ω′2 (t1+t2 )}e^{iω(t1−t2 )}, (12) or alternatively we may also relate Γ(t_1, t_2) to the CWF W (ω, t) through

Γ ( t + t^′ 2 , t − t^′ 2 ) = 2π ∫ dωW (ω, t)e^{iωt′} , (13) which corresponds to a form of the Wiener-Khintchine theorem for single photons [19].

Thus, the Fourier transform of ρ^D(ω, ω^′) with respect to the anti-diagonal frequency component ω^′ yields the Wigner function W (ω, t), while the Fourier transform of the Wigner function with respect to the diagonal frequency component yields the first-order temporal coherence function Γ(t + t^′/2, t − t^′/2). Note that if we define a density matrix in the temporal domain ρ^T_s (t_1, t_2) ≡ ⟨t_1|ρ̂_s|t_2⟩, in terms of |t⟩ ≡ ã^†(t)|0⟩, it is straightforward to show that ρ^T_s (t_1, t_2) = Γ^∗(t_1, t_2), a relationship which mirrors its counterpart in the spectral domain. Inverting Eq. 13 leads to a relationship between ρ^D(ω, ω^′) and W (ω, t), where the roles of time and frequency are reversed with respect to those in Eq. 6, i.e.

W (ω, t) = 1 4π^2 ∫ dt^′ρ^T_s ( t − t^′ 2 , t + t^′ 2 ) e^{−iωt′} , (14) which could be regarded as an alternate definition for the CWF.

Returning to the spectral domain, let us examine the conditions for the off-diagonal single-photon density matrix elements to be non-zero. In terms of ω and ω^′, the density matrix is given by the integral over ω_0 of f(ω + ω^′/2, ω_0)f^∗(ω − ω^′/2, ω_0). For a given pair of signal and idler frequencies ω_s = ω and ω_i = ω_0, for this integrand to be non-zero, clearly the JSA function must not vanish at the symmetrically-displaced pair of signalmode frequencies ω + ω^′/2 and ω − ω^′/2. Indeed, for a given ω and ω_0 the width in the frequency variable ω^′ of the integrand is closely related to the width of the JSA function along the signal-mode frequency variable. Note that if a one-to-one correspondence exists between the signal and idler frequencies, then this resulting width is zero, and the integrand above will be proportional to δ(ω^′). Thus, a first condition for the off-diagonal signalmode single-photon density matrix elements to be nonzero is that each idler frequency corresponds to a spread of signal frequencies rather than to a single signal frequency, i.e. that a strict correlation between signal and idler frequencies does not exist. Note that while a oneto-one correspondence in the signal and idler frequencies is consistent with maximal spectral entanglement, the correspondence of each idler frequency to a spread of signal frequencies is consistent with non-maximal spectral entanglement.

Even if each ω_i = ω_0 frequency corresponds to a spread of signal frequencies, the integration over the idler frequency ω_0 implies that the single-photon density matrix may still exhibit vanishing off-diagonal elements. Indeed, if the integrand is oscillatory in the variable ω_0, integration may lead to averaging and therefore to small or vanishing values. One way in which this may occur is in the case where the pump mode is chirped. In the specific case of a quadratic chirp, quantified by parameter β, the JSA becomes

f(ω_s, ω_i) = f_0(ω_s, ω_i)exp [ iβ(ω_s + ω_i − ω^0_p)^2 ] , (15)

where f_0(ω_s, ω_i) represents the unchirped JSA. In this case the density matrix becomes ρ^D_s (ω, ω^′) = e^{i2βω′(ω−ω0p)} ∫ dω_0f_0(ω + ω^′ 2 , ω_0)

× f^∗_0 (ω − ω^′ 2 , ω_0)e^{i2βω′ω0} . (16)

For given non-zero ω^′ and β values, the phase term in the integrand leads to oscillations as ω_0 is varied, with an oscillation period given by π/(βω^′). Thus, if the integration range for ω_0 is of the order, or if it exceeds this period, integration over ω_0 tends to make the off-diagonal elements vanish. A large chirp parameter β, or large ω^′ value (indicating matrix elements far from the diagonal) lead to a small oscillation period and thus favors small off-diagonal elements.

Thus, the existence of strong signal-idler correlations or the use of a chirped pump both lead to a small width of the density matrix ρ^D_s (ω, ω^′) along ω^′, and therefore favor a diagonal density-matrix structure. In the case of highly impure states, obtained through either of these two routes, the density matrix may be expressed as

ρ^D_s (ω, ω^′) = 1 √ πσ^′ I_ω (ω)e^{− ω′2}σ^{′2} . (17)

where σ^′ is a small quantitity. For a strictly impure state with σ^′ → 0 the CWF is then, according to the Fourier transform relationship of Eq. 6, time independent i.e.

W (ω, t) ∝ I_ω (ω), (18) Thus, a perfectly impure state leads to a constant temporal intensity profile, or in other words to an infinite single-photon temporal duration. Also, note from Eq. 13 and Eq. 18 that such a perfectly impure state leads to a first degree temporal coherence function of the following form

Γ(t_1, t_2) ∝ ∫ dωI_ω(ω)e^{iω(t1 −t2 )}. (19) Note that the above Γ(t_1, t_2) depends on the two arguments only through their difference. In other words, a perfectly impure single-photon state is statistically temporally stationary. In general terms, there is a link between the temporal duration of the signal photon and its degree of purity. In order to study this link, let us consider the temporal intensity profile I_t(t) of the signalmode single photon. This function is given by

I_t(t) ≡ ∫ dωW (ω, t) = 1 2π ∫ dω^′ ∫ dωρ^D_s (ω, ω^′) e^{−iω′t}. (20)

Normalization of I_t(t), i.e. ∫ dtI_t(t) = 1 is guaranteed by the normalization of the density matrix, i.e. Tr(ρ̂_s) = 1. As is clear from Eq. 20, this temporal profile is given by the Fourier transform of the density matrix averaged over all ω values. For an increasingly impure single-photon state, leading to a density matrix with an increasingly diagonal structure, the width of the ∫ dωρ^D_s (ω, ω^′) function along ω^′ is reduced, leading to an increased signal-mode temporal duration as dictated by the Fourier transform relationship of Eq. 20. This is consistent with the analysis in Ref. [18] carried out in the context of the Gaussian approximation for the JSA, leading to the result δtδω = 1/p, where δt and δω are the temporal duration and spectral width of the signal-mode single photon, respectively, and p is the single-photon purity. Thus, for example, as the pump chirp β is increased, while δω (the width of the marginal distribution of the joint spectrum |f(ω_s, ω_i)|^2) remains fixed, since the twophoton state depends on β only through a phase, the temporal duration δt is increased, leading to a an increased product δtδω, and consequently to a reduced purity p.

The relationship between photon pair-entanglement and single-photon purity is well understood. In fact, single photon purity is simply the reciprocal of the Schmidt number K, which quantifies the degree of photon-pair entanglement. This underscores the importance of factorable states, with K = 1, which lead to pure states, with p = 1. Conversely, highly-entangled photon pairs, with K → ∞, lead to highly impure single photons with p → 0 [16].

The joint spectral amplitude f(ω_s, ω_i) can be written as follows

f(ω_s, ω_i) = ϕ(ω_s, ω_i)α(ω_s + ω_i)e^{iβ(ωs+ωi−ω0p)2} , (21) in terms of the phasematching function (PMF) ϕ(ω_s, ω_i) which describes the optical properties of the nonlinear crystal, and the pump envelope function (PEF) α(ω)e^{iβ(ω−ω0p)2} which explicitly includes a quadratic chirp phase. The PMF may be written as ϕ(ω_s, ω_i) = sinc[LΔk(ω_s, ω_i)/2], in terms of the crystal length L and of the phasemismatch Δk(ω_s, ω_i) = k_p(ω_s +ω_i)−k_s(ω_s)− k_i(ω_i); here k_ν (with ν = p, s, i represents the wavenumber for each of the pump(p), signal(s), and idler(i).

In order to facilitate the analysis below, it is helpful to rely on an analytical expression for the CWF. As discussed in Ref. [18], this can be achieved through two approximations: i) expressing the JSA function entirely in terms of Gaussian functions, and ii) relying on a power series expansion, truncated at first order, of the Gaussian-approximated JSA argument. In this case, we can write the JSA function expressed in terms of detunings ν_{s,i} = ω_{s,i} − ω^0_{s,i} (where ω^0_{s,i} represent signal/idler central phasematched frequencies) as

f(ν_s, ν_i) = e^{−[X 2ssν2s +X 2iiν2i +2(X 2si −iβ)νsνi]}. (22)

In Eq. 22 we have used the following definition, with λ, μ = s, i: X_{λμ} ≡^1_{σ2} +^{γτλτμ}_4 , in turn written in terms of the pump bandwidth σ, the pump chirp parameter β, and parameter γ = 0.193 (related to the Gaussian approximation of the JSA, see Ref. [18]). This definition is also in terms of the signal/idler group velocity mismatch parameters τ_λ (with λ = s, i) given in terms of the crystal length L as τ_λ = L(k^′_p − k^′_λ); here, k^′ denotes the frequency derivative of the wavenumber associated to the each of the modes (p, s, i), evaluated at the respective central frequency.

Carrying out the corresponding integrations (Eqns. 3 and 6), we obtain the following expression for the CWF valid, for τ_s ≠ τ_i

W_s(ν, t) = √ 1 − C^2 πΔtΔω e^−(^{νΔω} )^2 e^−(^{tΔt} )^2 e^{−2C} (^{νΔω} )(^{tΔt} ).(23)

The parameters in Eq. 23 include a spectral width parameter Δω, its square given by

Δω^2 = β^2 + X_{ss}X_{ii} 2 [β^2(X_{ss} − 2X_{si} + X_{ii}) + X_{ss}(X_{ss}X_{ii} − X^2_{si})] , (24)

a temporal width parameter Δt, its square given by

Δt^2 =

2(β^2 + X_{ss}X_{ii}) X_{ii} , (25)

and a single-photon chirp parameter C given by

C = β(X_{ii} − X_{si}) √ X_{ii}[β^2(X_{ss} − 2X_{si} + X_{ii}) + X_{ss}(X_{ss}X_{ii} − X^2_{si})] (26) When plotted in a normalized chronocyclic space {ν/Δω, t/Δt}, the CWF has a circular shape for C = 0 and becomes elongated diagonally for C ≠ 0. In particular, for 0 < C < 1 the distribution involves correlated frequencies and times, while for −1 < C < 0 the distribution involves anti-correlated frequencies and times. For |C | = 1, the distribution becomes infinitely elongated, indicating the maximum degree of single-photon chirp. Using the inequality X^2_{si} ≤ X_{ss}X_{ii}, which may be readily proved, it is straightforward to show that Eq. 26 indeed fulfils |C | ≤ 1.

In the limiting case where τ_s → τ_i, corresponding to frequency anti-correlated photon pairs, X_{si} → X_{ss} = X_{ii} and it may be shown that Δω → ∞ and C → 0. This resulting infinite spectral width appears because for anticorrelated photon pairs the phasemathcing function and the pump envelope function have the same orientation in {ω_s, ω_i} space, and within the linear approximation of the phasemismatch used for the analytic expression of the CWF (Eqns. 23 to 26), the curvature of the phasematching function is suppressed. In a realistic i.e. unapproximated situation, the non-zero curvature leads to a finite (but large) spectral width.

As is evident from Eq. 26, in general in the absence of pump chirp, the signal-mode single photons are likewise unchirped. The presence of pump chirp can lead to single-photon chirp, depending on the type of spectral correlations in the SPDC photon pairs. In order to make this more evident, we can write the numerator of Eq. 26 proportional to βτ_i(τ_s − τ_i). As discussed in Ref. [16], a factorable state with an elongated joint spectrum is possible if τ_s = 0 or τ_i = 0. Thus, interestingly, a factorable, spectrally elongated state with τ_i = 0 is such that the signal-mode single photons remain unchirped despite an arbitrary level of pump chirp. Likewise a state with spectral anti-correlations, characterized by τ_s = τ_i which as discussed in the previous paragraph leads to C → 0, is also such that that the signal-mode single photons remain unchirped despite an arbitrary level of pump chirp (in this case, Eq. 26 should be evaluated in the limit where X_{si} → X_{ss} = X_{ii}). In general, for other types of joint spectra, the single photons become increasingly chirped as the level of pump chirp is increased.

We are interested in studying how certain key photonpair properties determine the resulting single-photon properties. In particular, we will consider the following two photon-pair properties: i) type of spectral correlations present as determined by the joint spectrum |f(ω_s, ω_i)|^2, and ii)level of quadratic pump chirp present, quantified through the parameter β. In turn, we are particularly interested in studying through the single-photon density matrix and the CWF, the singlephoton purity and the type of resulting chirp in the single photons. We will consider five representative types of two-photon state, as characterized by the type of spectral correlations present: i) spectral anti-correlations, ii) spectral positive correlations, iii) factorable state with a vertically-oriented joint spectrum, iv) factorable state with a horizontally-oriented joint spectrum and iv) factorable state with a symmetric joint spectrum.

Let us consider each of these types of two-photon states, in turn. Figs. 1 and 2 show schematically for these states how the joint spectrum is determined by the functions ϕ(ω_s, ω_i) and α(ω_s + ω_i). These figures also show schematically how quadratic pump chirp, together with the unchirped joint spectrum determine the chronocyclic structure of the single photons which constitute each of the photon pairs. In Fig. 1 each of the three rows correspond to the following states: positively-correlated state, anti-correlated state, and a version of the anti-correlated state exhibiting some curvature in the joint spectrum. In each row, the left-hand panel corresponds to a representation of the joint spectrum, with the blue band representing the phasematching function ϕ(ω_s, ω_i) and the gradient-colored band indicating the pump envelope function α(ω_s, ω_i). Note that the PEF exhibits the same orientation in {ω_s, ω_i} space for all three states, and in all

FIG. 1. Panels a, c, and e show schematically how the joint spectrum |f(ωs, ωi)|^2 is determined by the phasematching function |ϕ(ωs, ωi)|^2 and the pump envelope function |α(ωs + ωi)|^2. These three panels correspond to: a) positive correlations, c) anti-correlations with curvature suppressed, e)anti-correlations. Panels b), d) and f) show the corresponding inferred single-photon chronocylic structure.

cases the width indicates the use of a broadband, pulsed pump. However, the PMF shows a different orientation in each of the cases, determined by the specific crystal configuration used, which in part determines the resulting spectral entanglement characteristics.

The color gradient used to shade the PEF indicates the presence of quadratic pump chirp, in which case different pump frequencies correspond to different temporal “slices” of the temporally-broadened pump pulse. Thus, we can think of the chirped pump as composed of a temporal sequence of essentially single-frequency components. Each of these single-frequency components, Ω, corresponds to the locus ω_s + ω_i = Ω in {ω_s, ω_i} space.

In this manner, as time progresses within a given pulse, the pump probes different diagonal slices of the joint spectrum, i.e. the joint spectrum produced at a given pump pulse slice with frequency Ω can be written as |ϕ(ω_s, ω_i)α(ω_s + ω_i)|^2δ(ω_s + ω_i − Ω). The presence of chirp means that each Ω occurs at a different time, indicated schematically in Figs. 1 and 2 by black diagonal lines.

FIG. 2. Panels a, c, and e show schematically how the joint spectrum |f(ωs, ωi)|^2 is determined by the phasematching function |ϕ(ωs, ωi)|^2 and the pump envelope function |α(ωs + ωi)|^2. These three panels correspond to: a) factorable state with horizontally-oriented joint spectrum, c) factorable state with vertically-oriented joint spectrum, and e) factorable state with circular-shaped joint spectrum. Panels b), d) and f) show the corresponding inferred single-photon chronocylic structure.

From this information, it is possible to infer the chronocyclic structure of, say, the signal-mode single photon. As time progresses within a given quadratically-chirped pump pulse, a different diagonal slice of the joint spectrum is emitted. The signal-mode spectrum emitted at a given time is given by the intersection of the locus ω_s + ω_i = Ω (where Ω is time-dependent) with the unchirped joint spectrum |ϕ(ω_s, ω_i)α(ω_s + ω_i)|^2. The right panel on each row of Figs. 1 and 2 shows the inferred choronocyclic structure of the signal-mode single photon, obtained by plotting the points shown within each joint spectrum (left panels of these figures) in the signal-mode chronocyclic space {ω_s, t_s}.

There is clear relationship between the type of photonpair spectral correlations and the resulting single-photon chronocyclic properties. Let us review each of the types of spectral correlations. For photon pairs with positive correlations, there is a monotonic resulting relationship between the time within the pump pulse and the resulting signal-mode frequency. This results in temporal-spectral correlations in the signal-mode single photon, or in other words the signal-mode single photon becomes chirped. These correlations may be positive for positive β or negative for negative β. In contrast, for vanishing pump chirp the signal-mode single photon is likewise unchirped showing no spectral-temporal correlations.

Let us now turn our attention to spectrally anticorrelated photon pairs. In the idealized case of strict spectral anti-correlations, there is a single pump pulse time, related to a single pump frequency Ω that participates in the SPDC process. Thus, in this case despite the presence of pump chirp, all signal-mode frequencies correspond to a single time of emission, and thus arbitrarily strong pump chirp does not translate into single-photon chirp. Note that this is consistent with the conclusions reached in terms of our analytic experssion for the CWF (see Eq. 23); in this case, τ_s = τ_i means that C → 0 despite the presence of pump chirp. In a realistic situation for a broadband pump, the joint spectrum exhibits some curvature related to group velocity dispersion as shown schematically in Fig. 1(e). In this case, the locus ω_s + ω_i − Ω = 0 will intersect the joint spectrum at two distinct areas which approach each other, and eventually merge into a single zone, as Ω is reduced. The effect of this is that the curvature which characterizes the joint spectrum translates into a curvature in the singlephoton chronocyclic structure, as shown schematically in Fig. 1(f).

Let us now turn our attention to factorable photon pairs; we will consider three different kinds of factorable states: those with a horizontally-oriented joint spectrum, those with a vertically-oriented joint spectrum, and those with a symmetric joint spectrum. As may be seen from Fig. 2(a), in the case of a horizontally-oriented joint spectrum, the diagonal lines which indicate different pump pulse times intersect the joint spectrum at distinct points. Thus, in this case in a manner qualitatively similar to the positive-correlation case, there is a resulting correlation between the emission time and the signal-mode emission frequency. In the case of a vertically-oriented joint spectrum, the situation is different. Here, see Fig. 2(b), the different emission times of the selected points all correspond to the same signal-mode emission frequency. This implies that the presence of arbitrarily large pump chirp does not result in signal-mode single-photon chirp. Note that this is consistent with the conclusions reached in terms of our analytic expression for the CWF (see Eq. 23); in this case, τ_i = 0 means that C = 0 despite the presence of pump chirp.

In what follows, we present specific numerical calculations showing the density matrix on the one hand and the chronocyclic Wigner function on the other hand for each type of photon-pair spectral correlations, and also showing the effect of quadratic pump chirp. Note that for these numerical simulations we use the full, unapproximated joint amplitude function. As we will show, the intuition gained both from the joint spectrum schematics (Figs. 1 and 2) and from the analytic expression of the CWF (see Eq. 23) agree well with these numerical results. We will consider a specific implementation for each of the types of source considered above. Table I shows for each these sources: the type of crystal used, the configuration used (type I or type II), the crystal length L, the crystal cut angle θ_{pm}, the crystal phasematching bandwidth Δω_c, the pump center wavelength, λ_o, the pump bandwidth Δω and the Fourier-transform limited pulse duration τ. Note that we have used as definition of Δω_c the full width at half maximum of the function |ϕ(ω/2, ω/2)|^2, which may also be thought of as the pump-frequency acceptance function of the crystal.

Photon pair properties are determined by the characteristics of the crystal and of the pump. In particular, if Δω_c < Δω, the phase matching function dominates over the pump envelope function to determine the twophoton state, and if Δω < Δω_c, the pump envelope function dominates over the phase matching function. As may be seen in the table, among the particular states chosen for illustration purposes, for those characterized by an anti-correlated, horizontal and vertical joint spectrum, Δω_c < Δω, whereas for the positive-correlation and the factorable with a circular joint spectrum states, Δω_c > Δω.

In all sources considered here, see Table I, we assume frequency-degenerate, collinear SPDC. Likewise, in all cases involving non-zero pump chirp, we have assumed a value of β = 8 × 10^{−26}s^2.

Fig. 3 corresponds to the state with positive correla- tions; panel (a) shows the joint spectrum. The entan-

TABLE I. PARAMETERS Correlation Crystal characteristics Pump Type L θP M Δωc λo Δλ (Δω) τ Horizontal KDP-II 5 mm 67.8^o 15.6 THz 415 nm 5 nm (54.7 THz) 50.7 fs Vertical KDP-II 5 mm 67.8^o 15.6 THz 415 nm 5 nm (54.7 THz) 50.7 fs Positive BBO-II 10 mm 28.8^o 208.2 THz 757 nm 20 nm (65.8 THz) 42.1 fs Negative BBO-I 2 mm 29.2^o 28.3 THz 400 nm 5 nm (58.9 THz) 47.1 fs Circular BBO-II 2.293 mm 28.8^o 328.9 THz 757 nm 15 mm (49.3 THz) 56.2 fs

FIG. 3. For a state with positive spectral correlations: a) joint spectrum |f(ωs, ωi)|^2, b) signal-mode, single-photon density matrix |ρs(ω1, ω2)| with the single-photon purity value indicated, c) same as b) but with pump chirp β = 8 × 10^{−26} s^2, d) single-photon chronocyclic Wigner function W (ω, t), e) same as d) but with pump chirp β = 8 × 10^{−26}s^2. Note: for convenience frequency axes are labeled in terms of wavelength.

glement present implies that the signal-mode single photons are impure, as indicated by the diagonal structure of the density matrix; panel (b) is a plot of |ρ_s(ω_1, ω_2)|, for β = 0. The presence of pump chirp further reduces the width along the anti-diagonal, i.e. ω^′, direction of the density matrix, as discussed above due to averaging, see panel (c). In the absence of pump chirp, signal-mode single photons are unchirped, i.e. emission times and frequencies are uncorrelated, as is clear from the CWF plotted in panel (d). The presence of pump chirp, as discussed above for this state, has the effect of chirping the signal-mode single photon as is clear from the time-frequency correlations in the CWF plotted in the presence of chirp, see panel (e).

Fig. 4 corresponds to the spectrally anti-correlated state; panel (a) shows the joint spectrum. Note that the

FIG. 4. For a state with negative spectral correlations: a) joint spectrum |f(ωs, ωi)|^2, b) signal-mode, single-photon density matrix |ρs(ω1, ω2)| with the single-photon purity value indicated, c) same as b) but with pump chirp β = 8×10^{−26} s^2, d) single-photon chronocyclic Wigner function W (ω, t), e) same as d) but with pump chirp β = 8 × 10^{−26} s^2. Insets show the result of transmitting the signal and idler photons through a Gaussian-profile spectral filter with 100nm bandwidth. Note: for convenience frequency axes are labelled in terms of wavelength.

joint spectrum exhibits some curvature in the {ω_s, ω_i} space, related to group velocity dispersion of the SPDC photon pair. The emission bandwidth, i.e. the width of the SPS, of 0.23μm is considerable. The inset of panel (a) shows the joint spectrum assuming that the signal and idler photons are each transmitted through a Gaussianprofile bandpass filter with 100 nm bandwidth; as can be appreciated, the curvature is then essentially suppressed. As in the case of positive correlations, the entanglement present implies that the signal-mode single photons are impure as indicated by the diagonal structure of the density matrix; panel (b) is a plot of |ρ_s(ω_1, ω_2)|, for β = 0. Again, the presence of pump chirp further reduces the width the along the anti-diagonal of the density matrix due to averaging, see panel (c). As for the positivelycorrelated case, in the absence of chirp, the signal-mode single photons are unchirped, i.e. emission times and frequencies are uncorrelated, as is clear from the CWF plotted in panel (d). As discussed above, the anti-correlated state is relatively insensitive to pump chirp. Let us first consider the filtered state shown in the inset of panel (a). The effect of pump chirp on the CWF for this filtered, anti-correlated state, may be seen in the inset of panel (e); it is clear that despite the presence of pump chirp, there is no resulting chirp in the signal-mode single photons. In the case where spectral filtering is not used, the CWF shows a curvature which, as discussed above, is related to the curvature of the joint spectrum; see panel (e).

FIG. 5. For a factorable state with a horizontally-oriented joint spectrum: a) joint spectrum |f(ωs, ωi)|^2, b) signalmode, single-photon density matrix |ρs(ω1, ω2)| with the single-photon purity value indicated, c) same as b) but with pump chirp β = 8 × 10^{−26} s^2, d) single-photon chronocyclic Wigner function W (ω, t), e) same as d) but with pump chirp β = 8 × 10^{−26} s^2. Note: for convenience frequency axes are labelled in terms of wavelength.

Fig. 5 corresponds to the factorable state, with a horizontally-oriented joint spectrum; panel (a) shows a plot of the joint spectrum. The nearly-factorable character of the photon-pair state implies that the signal-mode single photons are basically pure in the absence of pump chirp. This in turn implies that some of the coherences, i.e. the off-diagonal elements of the density matrix are non-zero. This is evident in panel (b), which represents a plot of |ρ_s(ω_1, ω_2)|. The presence of pump chirp has the expected effect of averaging out the off-diagonal elements,

FIG. 6. For a factorable state with a vertically-oriented joint spectrum: a) joint spectrum |f(ωs, ωi)|^2, b) signalmode, single-photon density matrix |ρs(ω1, ω2)| with the single-photon purity value indicated, c) same as b) but with pump chirp β = 8 × 10^{−26} s^2, d) single-photon chronocyclic Wigner function W (ω, t), e) same as d) but with pump chirp β = 8 × 10^{−26} s^2. Note: for convenience frequency axes are labelled in terms of wavelength.

so that the density matrix acquires a diagonal structure, as shown un panel (c). In the absence of pump chirp, signal-mode single photons are unchirped, i.e. emission times and frequencies are uncorrelated, as is clear from the CWF, plotted in panel (d). The presence of pump chirp, as discussed above for this state, has the effect of chirping the signal-mode single photon as is clear from the time-frequency correlations in the CWF plotted for β ≠ 0, see panel (e).

Fig. 6 corresponds to the factorable state, with a vertically-oriented joint spectrum; panel (a) shows a plot of the joint spectrum. The nearly-factorable character of the photon-pair state implies that the signal-mode single photons are basically pure in the absence of pump chirp. As for the factorable state with a horizontally-oriented joint spectrum, this in turn implies that some of the coherences, i.e. the off-diagonal elements of the density matrix are non-zero. This is evident in panel (b), which represents a plot of |ρ_s(ω_1, ω_2)|. The presence of pump chirp has the expected effect of averaging out the offdiagonal elements, so that the density matrix acquires a diagonal structure, as shown un panel (c). In the absence of pump chirp, signal-mode single photons are unchirped, i.e. emission times and frequencies are uncorrelated, as is clear from the CWF, plotted in panel (d). As discussed above, this state has the property that despite

FIG. 7. For a factorable state with a circular-shaped joint spectrum: a) joint spectrum |f(ωs, ωi)|^2, b) signal-mode, single-photon density matrix |ρs(ω1, ω2)| with the singlephoton purity value indicated, c) same as b) but with pump chirp β = 8 × 10^{−26} s^2, d) single-photon chronocyclic Wigner function W (ω, t), e) same as d) but with pump chirp β = 8 × 10^{−26} s^2. Note: for convenience frequency axes are labelled in terms of wavelength.

the presence of pump chirp, the signal-mode single photons remain basically unchirped, as is evident from the CWF with β ≠ 0, plotted un panel (e).

Finally, Fig. 7 corresponds to the factorable state, with a symmetric, or circularly-shaped, joint spectrum; panel (a) shows a plot of the joint spectrum. The nearlyfactorable character of the photon-pair state implies that the signal-mode single photons are basically pure in the absence of pump chirp. As for the previous two types of factorable states above, this in turn implies that for β = 0 some of the coherences, i.e. the off-diagonal elements of the density matrix are non-zero. This is evident in panel (b), which represents a plot of |ρ_s(ω_1, ω_2)|. The presence of pump chirp has the expected effect of averaging out the off-diagonal elements, so that the density matrix acquires a diagonal structure, as shown un panel (c). In the absence of pump chirp, signal-mode single photons are unchirped, i.e. emission times and frequencies are uncorrelated, as is clear from the CWF, plotted in panel (d). In the presence of pump chirp, the signal-mode single photons the signal-mode single photons acquire a chirp as is evident from the CWF with β ≠ 0, plotted un panel (e).

III. CONCLUSIONS

In this paper we have studied the chronocyclic properties of the single-photon constituents of photon pairs generated by the process of spontaneous parametric down conversion. We have studied how photon-pair properties, in particular, i)the type of signal-idler spectral correlations, and ii) pump chirp, determine the resulting singlephoton properties, in particular the purity and the singlephoton chirp. We have studied single-photon properties through the corresponding single-photon spectral density matrix ρ_s(ω_1, ω_2), and in chronocyclic space through the single-photon chronocyclic Wigner function W (ω, t), and how these are determined by photon pair properties, including the joint spectrum |f(ω_s, ω_i)|^2 and the level of pump chirp β. We have studied the relationship between these functions and the first degree of spectral coherence S(ω_1, ω_2) on the one hand, and the first degree of temporal coherence Γ(t_1, t_2) on the other hand.

As we have shown before, pump chirp may be used as an effective tool to control photon-pair entanglement, or equivalently to control the single-photon purity. Varying the level of pump chirp in order to control spectral entanglement, also results in a modified chronocyclic singlephoton character. In this paper we focus on the study of this single-photon chronocyclic character, in particular the single-photon chirp, and how this is determined by photon pair properties. We find that besides the previously-understood link between pump chirp and degree of photon pair entanglement or single photon purity, pump chirp in general leads to single-photon chirp, in a manner determined by the type of spectral correlations present. In fact, for certain types of signal-idler spectral correlations single photons remain unchirped despite the presence of pump chirp. We hope that this paper will contribute to a better appreciation of the multi-mode, spectral and temporal, character of single photons derived from spontaneous parametric downconversion.

ACKNOWLEDGMENTS

This work was supported in part by CONACYT, Mexico, by DGAPA, UNAM and by FONCICYT project 94142. We would like to thank Y. Jeronimo-Moreno and K. Garay-Palmett, for stimulating discussions.

[1] P.G. Kwiat, K. Mattle, H. Weinfurter, A. Zeilinger, A.V.

Sergienko, and Y. Shih, Phys. Rev. Lett. 75, 4337 (1995). [2] P.G. Kwiat, E. Waks, A.G. White, I. Appelbaum, and P.H. Eberhard, Phys. Rev. A 60, R773R776 (1999).

[3] A. Mair, A. Vaziri, G. Weihs, and A. Zeilinger, Nature 412, 313 (2001).

[4] C.I. Osorio, A. Valencia, and J.P. Torres New J. Phys.

10 113012 (2008).

[5] L. E. Vicent. A. B. U’Ren, R. Rangarajan, C. I. Osorio, J. P. Torres, L. Zhang, and I. A. Walmsley, New J. Phys. 12, 093027 (2010).

[6] W. P. Grice and I. A. Walmsley, Phys. Rev. A 56, 16271634 (1997).

[7] J.C. Howell, R.S. Bennink, S.J. Bentley, and R.W. Boyd, Phys. Rev. Lett. 92, 210403 (2004).

[8] A. Haase, N. Piro, J. Eschner, and M. W. Mitchell, Opt.

Lett. 34, 55 (2009)..

[9] K.A. O’Donnell and A.B. U’Ren, Opt. Lett. 32 817 (2007).

[10] P. J. Mosley, J. S. Lundeen, B. J. Smith, P. Wasylczyk, A. B. URen, C. Silberhorn and I. A. Walmsley, Phys. Rev. Lett. 100, 133601 (2008).

[11] A.B. U’Ren, C. Silberhorn, K. Banaszek and I.A. Walmsley, Phys. Rev. Lett. 93 093601 (2004).

[12] T.B. Pittan, B.C. Javobs, and J.D. Franson, Opt. Comm.

246 545 (2005).

[13] A. I. Lvovsky, H. Hansen, T. Aichele, o. Benson, J.

Mlynek, and S. Schiller, Phys. Rev. Lett. 87, 050402 (2001).

[14] T. Aichele, A. I. Lvovsky, and S. Schiller, Eur. Phys. J.

D 18, 237 (2002).

[15] Y. Jeronimo-Moreo and A.B. U’Ren, Phys. Rev. A 79, 033839 (2009).

[16] A. B. U’Ren, Ch. Silberhorn, R. Erdmann, K. Banaszek, W. P. Grice, I. A. Walmsley, and M. G. Raymer, Laser Phys. 15, 146 (2005).

[17] J. Paye, IEEE J. Quantum Electron 28, 2262 (1992). [18] A.B. U’Ren, Y. Jeronimo-Moreno and Hipolito García- Gracia, Phys. Rev. A 75, 023810 (2007).

[19] V. Torres-Company, A. Valencia and J.P. Torres, Opt.

Lett. 34, Issue 8, 1177-1179 (2009).