arXiv:1204.3951v1 [astro-ph.CO] 18 Apr 2012

Accepted for Publication in the Astrophysical Journal

Preprint typeset using L^ATEX style emulateapj v. 5/2/11

COSMIC ORIGINS SPECTROGRAPH OBSERVATIONS OF WARM INTERVENING GAS AT Z ∼ 0.325 TOWARDS 3C 263^1

Anand Narayanan^2, Blair D. Savage, & Bart P. Wakker^3 Accepted for Publication in the Astrophysical Journal

ABSTRACT We present HST /COS high S/N observations of the z = 0.32566 multi-phase absorber towards 3C 263. The COS data shows absorption from H i (Ly-α to Ly-θ), Ovi, C iii, Niii, Si iii and C ii. The Ne viii in this absorber is detected in the F USE spectrum along with O iii, O iv, and N iv. The low and intermediate ions are kinematically aligned with each other and H i and display narrow line widths of b ∼ 6 − 8 km s^{−1}. The Ovi 1031, 1037 Å lines are kinematically offset by Δv ∼ 12 km s^{−1} from the low ions and are a factor of ∼ 4 broader. All metal ions except Ovi and Ne viii are consistent with an origin in gas photoionized by the extragalactic background radation. The bulk of the observed H i is also traced by this photoionized medium. The metallicity in this gas phase is Z^>∼ 0.15 Z_⊙ with carbon having near-solar abundances. The Ovi and Ne viii favor an origin in collisionally ionized gas at T = 5.2 × 10^5 K. The H i absorption associated with this warm absorber is a BLA marginally detected in the COS spectrum. This warm gas phase has a metallicity of [X/H] ∼ −0.12 dex, and a total hydrogen column density of N(H) ∼ 3 × 10^{19} cm^{−2} which is ∼ 2 dex higher than what is traced by the photoionized gas. Simultaneous detection of Ovi, Ne viii and BLAs in an absorber can be a strong diagnostic of gas with T ∼ 10^5 − 10^6 K corresponding to the warm phase of the WHIM or shock-heated gas in the extended halos of galaxies.

Subject headings: galaxies: halos, intergalactic medium, quasars: absorption lines, quasars: individual: 3C 263, ultraviolet: general

1. INTRODUCTION

Throughout cosmic history, the intergalactic medium (IGM) and the gaseous envelopes surrounding galaxies have retained more baryons compared to the gas settled into galaxies. In the z < 0.5 universe, > 50% of the baryons are predicted to be in the form of low density (nH ∼ 10^{−5} cm^{−3}) intergalactic gas at temperatures of T ∼ 10^5 − 10^7 K and moderate overdensities of ρ/ρ̄ ∼ 20. These baryons, which were once part of the cool (T^<∼ 10^4 K) photoionized IGM probed by the Lyα forest at z^>∼ 3, were heated through gravitational shocks during the formation of large scale structures (Cen & Ostriker 1999; Davé et al. 2001; Valageas et al. 2002). The temperatures imply that this warm-hot intergalactic medium (WHIM) gas has a high degree of ionization. Physical conditions similar to the WHIM can also exist in gas in the extended halos of galaxies. Cosmological simulations predict that massive halos (> 10^{12} M_⊙) acquire most of their gas through the hot-mode of accretion, where the infalling intergalactic gas is shock-heated

1 Based on observations with the NASA/ESA Hubble Space Telescope, obtained at the Space Telescope Science Institute, which is operated by the Association of Universities for Research in Astronomy, Inc., under NASA contract NAS 05-26555, and the NASA-CNES/ESA Far Ultraviolet Spectroscopic Explorer mission, operated by the Johns Hopkins University, supported by NASA contract NAS 05-32985.

2 Indian Institute of Space Science & Technology, Thiruvananthapuram 695 547, Kerala, INDIA. Email: anand@iist.ac.in 3 Department of Astronomy, The University of Wisconsin- Madison, 5 534 Sterling Hall, 475 N. Charter Street, Madison WI 53706-1582, USA, Email: savage, wakker@astro.wisc.edu

to the virial temperatures of T^>∼ 10^6 K (Kereš et al. 2005; van de Voort et al. 2011). This infalling gas may circulate within the halo for a long time before it can radiatively cool and flow into the disc. Other galacticscale processes such as supernova driven flows and tidal interactions/mergers can also increase the temperature and ionization levels of gas in regions close to galaxies.

Observations of warm gas with T ∼ 10^5 − 10^6 K in the low-z universe has been accomplished primarily through quasar absorption line spectroscopy in the far-UV of highly ionized metals, particularly Ovi 1031, 1037 Å lines (Tripp & Savage 2000; Richter et al. 2004; Danforth & Shull 2005; Stocke et al. 2006; Danforth & Shull 2008; Tripp et al. 2008) and more recently Ne viii 770, 780 Å (Savage et al. 2005; Narayanan et al. 2009, 2011; Meiring et al. 2012). The fractional abundances of these ions peak in the interval T ∼ (2 − 7) × 10^5 K when ionizations are controlled by ion-electron collisions. Limitations in accessing the FUV wavelengths of the Ne viii resonant transitions and the relatively lower cosmic abundance of neon compared to oxygen has resulted in fewer Ne viii findings compared to Ovi. On the other hand, the detection of Ne viii has the advantage that it requires the presence of collisionaly ionized warm gas. In the case of Ovi it is not straightforward to distinguish a photoionization origin from collisional ionization in warm gas.

A strong correlation between the incidence of Ovi absorption and galaxies has been emerging from recent absorber-galaxy surveys. The Ovi absorption at low-z seems to be preferentially selecting circumgalactic environments of typical star forming galaxies (Savage et al. 2002; Fox et al. 2004; Stocke et al. 2006; Wakker & Savage 2009; Tumlinson et al. 2011b; Meiring et al. 2012). The covering fraction of Ovi absorbing gas is estimated to be^>∼ 65% around emission line galaxies (Chen & Mulchaey 2009), comparable to the covering fraction of high-velocity Ovi around the Milky Way (Sembach et al. 2003). In the case of the Milky Way, the halo Ovi absorption is known to be from multi-phase high velocity clouds where the Ovi is produced in T ∼ (2 − 5) × 10^5 K transition temperature plasma at the interface layers between the T^<∼ 10^4 K neutral interstellar gas in HVCs and the T ∼ 10^6 K coronal halo of the Galaxy (Sembach et al. 2003; Fox et al. 2006). As analogs of Galactic HVCs, some fraction of the population of extragalactic warm absorbers could be tracing halo gas associated with galactic-scale processes such as outflows from star formation (Heckman et al. 2001), accretion of WHIM gas from the nearby intergalactic filaments (Narayanan et al. 2010b; Tumlinson et al. 2011a) and/or tidal streams from interactions and mergers with companion galaxies similar to the Magellanic Stream around the Milky Way, with which Ovi absorption is clearly associated (Sembach et al. 2003).

In the few known Ne viii absorbers, associated Ovi has always been detected, and both ions are found to be tracing warm gas with T^>∼ 10^5 K (Savage et al. 2005; Narayanan et al. 2011). Simultaneous detection of Ne viii and Ovi can be a strong diagnostic on the temperature of the gas. The warm temperature and high levels of collisional ionization would result in thermally broadened (b(H i) > 40 km s^{−1}) and often shallow Lyα features (Richter et al. 2006; Danforth et al. 2010; Narayanan et al. 2010b). Detection of absorption from highly ionized species and broad-Lyα absorbers (BLAs) in the low-z universe can be used as probes of the WHIM or halo gas transiting between galaxies and the surrounding IGM.

This paper adds important FUV HST /Cosmic Origins Spectrograph (COS) data on the z = 0.32566 Ne viii absorber previously detected with F USE data (Narayanan et al. 2009). The detection of Ne viii indicated the presence of T^>∼ 10^5 K collisionally ionized gas, but the relatively few lines covered in the F USE spectrum (O iii, O iv and N iv) were inadequate to constrain the ionization conditions and metallicity in this absorber. The COS spectra are obtained at high S/N and provide coverage of a large number of absorption lines, most importantly Ovi and H i. In Sec 2 and 3 we describe the COS observations and F USE observations for this sight line. The line detections and the multiphase properties of the absorber are discussed in detail in Sec 4, followed by predictions from photoionization and collisional ionization models in Sec 5.

2. COS OBSERVATIONS OF 3C 263

COS observations of 3C 263 were carried out as part of the HST Cycle 19 GTO Program ID 11541 (PI Green). The capabilities of COS are described in detail by Green et al. (2012), Froning & Green (2009) and the on-orbit performance of the instrument is discussed by Osterman et al. (2011). The 3C 263 observations consisted of FUV spectra obtained at intermediate resolutions (FWHM ∼ 17 km s^{−1}) using the G130M and G160M COS gratings with total exposure times of 15.4 ks and 18.0 ks respectively. The details on the individual exposures are given in Table 1. Different grating central wavelength settings were used for the separate exposures. For different grating central wavelength settings the dispersed light for a particular wavelength falls on a different region of the detector. This helps to reduce the amplitude of detector fixed pattern noise in the final coadded spectrum. The setup also allows for the coverage of the ∼ 9 Å wavelength gap introduced by the separation between the two segments of the COS detector. The data were extracted using the STScI CalCOS v2011.1a pipeline. The separate one dimensional spectra were coadded in flux units weighted by their respective exposure time using the routine developed by Charles Danforth and the COS GTO team^4. The final coadded spectrum has a wavelength coverage of 1150 − 1750 Å with a S/N ∼ 18 − 35 per 17 km s^{−1} resolution element. The pipeline reduced data are however sampled at 6 detector pixels per resolution element and throughout we display the COS spectra with this sampling. The COS wavelength calibration is accurate to ∼ 15 km s^{−1} but has been improved to ∼ 8 km s^{−1} through cross referencing of prominent IGM and ISM absorption lines.

3. F USE OBSERVATIONS OF 3C 263

The 3C 263 was observed by F USE (Moos et al. 2000; Sahnow et al. 2000) for a total of 260 ks under various observing programs. The spectra were processed using the CALFUSE (ver 2.4) data reduction pipeline software. F USE covers the wavelength range from 912 Å to 1185 Å sampling the spectrum at a resolution of ∼ 20 km s^{−1} (FWHM). The S/N of the spectrum at λ > 1000 Å is ∼ 10 − 15 per 17 km s^{−1} bin size. The procedures adopted in the coaddition of the spectrum and for correcting the zero-point velocity offset errors are similar to the detailed description given in Wakker et al. (2003). More details can be found in Narayanan et al. (2009).

4. MULTI-PHASE NATURE OF Z = 0.32566 ABSORBER

In Figures 1a - 1b, we display the z = 0.32566 centered system plot with prominent metal lines and H i detected by both COS and F USE. To be consistent with the previous F USE analysis of this absorber, we adopt the same system redshift as given in Narayanan et al. (2009). The continuum normalization was done by fitting low-order polynomials to the region around each absorption feature. The metal lines with > 3σ detection by COS for this absorber are C ii 903.96 Å, C ii 903.62 Å, C ii 1036 Å, C iii 977 Å, Niii 989 Å, Si iii 1206 Å and Ovi 1031, 1037 Å. In the system plot we also show non-detections of lines corresponding to Nii and Si ii. In F USE, O iii 832 Å, O iv 787 Å, N iv 765 Å and Ne viii 770 Å are seen along with a non-detection of O ii 834 Å.

4 http://casa.colorado.edu/∼danforth/science/cos/costools.html

Measurements on all the lines were carried out using the apparent optical depth (AOD) technique of Savage & Sembach (1991). The AOD measurements on the COS data are listed in Table 2. The column density N, Doppler parameter b and velocity v of the line components were also determined through Voigt profile modeling of the lines using the Fitzpatrick & Spitzer (1997) routine. While performing the fits, the model profiles were convolved with the emperically determined line spread functions of Kriss (2011) for the redshifted wavelength of each line. The fitting results are given in Table 3. The COS spectrum shows strong absorption from C iii 977 Å with at least two components at velocities of -23 km s^{−1} and +12 km s^{−1}. Coincident with the positive velocity component are also seen absorption from Niii, Si iii, C ii and H i. For the negative velocity component, these metal ions are non-detections in the COS spectrum down to the 3σ significance level. The difference in the corresponding line strengths between the two components is indicative of ionization or metallicity gradients within the absorber. The C iii 977 Å being a strong line (f_{osc} = 0.762) is susceptible to saturation unresolved at the FWHM ∼ 17 km s^{−1} of the COS data. Strong saturation will result in the AOD measurements underestimating the column densities in the line cores. We find a difference of ∼ 0.32 dex in the column densities between the two measurements. The profile fit to C iii yields a b(C iii) = 9 ± 3 km s^{−1} for the positive velocity component. The narrower b-values for C ii and Si iii indicate that the true dispersion in the low ionization gas could be smaller than what we measure for C iii. Instrumental broadening of narrow spectral lines would result in the column density getting underestimated so as to preserve the equivalent width. Lowering the b(C iii) from its measured value of 9 km s^{−1} to 6 km s^{−1} (the 1σ lower limit) yields a column density which is 0.7 dex higher than the free-fit value of 13.67 dex. This shows that the degree of unresolved saturation is significant if the b(C iii) is narrower than what we measure. To account for this possibility, we increase the +1σ uncertainty to 0.7 dex in the profile fit N-value for the positive velocity component of the C iii 977 Å line.

The Si iii 1207 Å line is covered by the G160M grating of the COS spectrum. The positive velocity component is very narrow with a measured b(Si iii) = 5 ± 3 km s^{−1}. The profile fit column density is ∼ 0.3 dex larger than the apparent column density, but within the combined ∼ 1σ errors associated with the measurements. At v ∼ −20 km s^{−1}, weak absorption is detected at ∼ 4σ significance which is consistent with being Si iii corresponding to the negative component seen in C iii and H i. The C ii multiplet transitions at 903.6235 Å (f_{osc} = 0.168), 903.9616 Å (f_{osc} = 0.336) and 1036.3367 (f_{osc} = 0.123) are detected with > 3σ significance. In the N_a(v) comparsion in Figure 3, we find the apparent column density profile of the stronger C ii line is lower than the weaker lines. The C ii line is possibly stronger and narrower than the observed profile but has been blurred by the instrumental spread function. The N_a(v) integrated column density obtained is therefore only a lower limit. The difference in N_a values between the weaker (C ii 1036 Å) and the stronger (C ii 903.9616 Å) transitions is 0.11 dex. This difference can be used to compensate for the instrumental broadening, as described in Savage & Sembach (1991). The corrected apparent column density measurement of log N_a(C ii) = log N_a(C ii 1036) + Δ log N_a = 13.29 ± 0.11 dex is consistent with the column density obtained from simultaneous profile fitting of the three lines. The N_a(v) comparison in Figure 3 also shows small excess absorption in the C ii 903.9616 Å line between 30 < v < 75 km s^{−1} possibly due to line contamination. The separate profile fit on this line yields a larger b value compared to the two weaker C ii transitions. We obtain log N(C ii) = 13.26 ± 0.03 dex and b(C ii) = 8 ± 2 km s^{−1} from simultanesouly fitting the three C ii lines. A lower b(C ii) = 6 km s^{−1} would result in log N(C ii) = 13.28 km s^{−1} which is within the statistical uncertainty in the measurement.

The COS spectrum shows absorption in H i from Ly-α to Ly-θ. The Ly-δ (H i 949 Å) line suffers contamination from Galactic Si ii 1260 Å and possibly also from Sii 1260 Å. The Lyα and Lyβ lines have saturated profiles. The column density and the component structure of H i are best constrained in the higher order Lyman lines with kinematic sub-structure evident in the H i 938 Å and H i 926 Å profiles. Due to the effect of random noise, the corresponding component structures are not conspicuous in all higher order Lyman lines. We simultaneously fitted the Lyman series lines (except Lyδ which is affected by contamination) by keeping v, b and N as free parameters. The best-fit model gave two components of roughly equal strength contributing to the core H i absorption (see Table 3). The b ∼ 17 km s^{−1} for either component is consistent with temperature for photoionized gas. A comparison of the N_a(v) profiles of H i 938 and H i 926 Å lines with C iii 977 Å show similar two component velocity structure (see Figure 3). This kinematic coincidence indicates that the bulk of the H i is contributed by the same gas phase as C iii.

The wings of the Lyα profile show the possible presence of a very broad component superimposed on the saturated H i core and spread over the velocity interval [−v, +v] = [−130, +130] km s^{−1}. This excess absorption could also be due to the presence of additional narrow kinematic sub-structures. The resolution of COS is not adequate to rule out this additional complexity in H i kinematics. The total column density of H i obtained from the free-fit to the Lyman transitions however does not account for this extra absorption in the far wings of the Lyα profile. We discuss more about this possible broad-Lyα feautre in Sec 7.

The Ovi is a strong absorption seen in both members of the doublet. The N_a(v) profiles for the Ovi 1031, 1037 Å lines, shown in Figure 3, are in good agreement with each other suggesting little contamination or unresolved saturation. The doublet lines were simultaneously fitted with a single component. The profiles do not shown evidence for any kinematic substructure. The parameters of the profile fit are given in Table 3. The central velocity of the Ovi absorption is distinct from the velocities of either component seen in C iii or the core absorption in H i. Also, the best-fit b parameter for the Ovi line is a factor of ∼ 4 broader than the C iii or H i line widths, which suggests that the two ions are tracing separate gas phases.

In Table 4, we report the equivalent widths and the total apparent column densities for the > 3σ transitions seen in the F USE spectrum. The F USE spectrum has a factor of ≳ 3 lower S/N compared to COS. At the low S/N, the component structure is not evident in the O iii 833 Å, O iv 788 Å, N iv 765 Å or Ne viii 770 Å lines. The integration range of the N_a(v) profiles for the intermediate ion transitions were therefore broken into two regions of [−75, −10] km s^{−1} and [−10, 75] km s^{−1} to match with the component structure seen in C iii, Niii, Si iii, C ii and H i in the COS spectrum. To compensate for our lack of independent information on the component structure in the low S/N data, we double the logarithmic errors in the F USE N_a measurements.

5. IONIZATION MODELING OF THE MULTIPHASE ABSORBER

5.1. Photoionization of the Low & Intermediate Ions

The large difference in the b-parameter and the kinematic offset of |Δv| ∼ 12 km s^{−1} between Ovi and the low/intermediate metal ions and the H i core points to the presence of multiple ionization phases in the absorber. For modeling the physical conditions in the absorber, we consider the two possible scenarios of ionization by EUV radiation and ionization from ion-electron collisions. The H i and C iii lines show absorption in two kinematically distinct components. The column density ratios of the various ions in these two components suggests different ionization conditions in the two clouds. However constraints are adequate only for the positive velocity component, and hence we only model that component. Using the photoionization code Cloudy (version C08.00; Ferland et al. (1998)) we solve for the models that best reproduce the observed column density ratios. We have assumed an ionizing background radiation field with contributions from both AGNs and star forming galaxies as modeled by Haardt & Madau (2001).

In the positive velocity cloud, the constraint on density comes from the column density ratios of C, N and O in their adjacent ionization levels, log N(C ii)/N(C iii) ∼ −0.41, log N(Niii)/N(N iv) ∼ 0.65 and log N(O iii)/N(O iv) ∼ 0.15, along with upper limits of log N(Nii)/N(Niii)^<∼ − 0.75, log N(O ii)/N(O iii)^<∼ − 0.20, and log N(Si ii)/N(Si iii)^<∼ 0.04. By fixing the H i column density in this component to the measured value of log N(H i) = 15.20 dex, we ran a series of Cloudy models for a range of ionization parameters. The ionic column densities predicted by the photoionization models are shown in Figure 4. The models are consistent with the observed column density ratios within the narrow interval of −2.6 ≤ log U ≤ −2.1. This corresponds to a density range of nH ∼ (0.4 − 2) × 10^{−3} cm^{−3}. The single phase photoionization model which best fits the low and intermediate ions at log U ∼ −2.2 predicts nH ∼ 5 × 10^{−4} cm^{−3}, total hydrogen column density of N(H) ∼ 2 × 10^{18} cm^{−2}, T ∼ 1.4 × 10^4 K, pressure of p/K ∼ 16 K cm^{−3}, and a path length of ∼ 1.6 kpc through the absorber.

For the given N(H i) value, N(O iii) and N(O iv) are simultaneously predicted at log U ∼ −2.2 when the oxygen abundance is [O/H] = −0.8 ± 0.1 dex. The uncertainty comes from the 1σ errors in the column density measurements. To reproduce the other low and intermediate ionic column densities from the same phase, the abundances have to be [C/H] = 0 ± 0.04 dex, [N/H] = −0.3 ± 0.1, and [Si/H] = −0.6 ± 0.3 dex. The higher abundance of carbon is required to explain the observed N(C ii). The model prediction for N(C ii) has its peak at log U ∼ −2.5 and does not vary much in the interval −3.2^<∼ log U^<∼ − 1.8, which sets a robust constrain on the carbon abundance. The estimated abundances are subjected to larger systematic uncertainties at the level of ∼ 0.4 dex because of ambiguities in the shape and intensity of the ionizing radiation field and assumptions inherent in the Cloudy models.

The most important result from this modeling analysis is that Ovi and Ne viii do not occur in the cool (T^<∼ 10^4 K) photoionized phase of the absorber. The photoionization model predictions for the Ovi column densities are^<∼ 3 dex lower than the observed column density. Photoionization of Ne viii requires extremely high ionization parameters of log U ∼ −0.8 for even solar [Ne/H] abundances. The corresponding densities of nH ∼ 10^{−5} cm^{−3} lead to very large path lengths (^>∼ 1 Mpc). Absorption over such large path lengths is unlikely to result in the kinematically simple line profiles seen for these high ions. Furthermore, the broadening induced by the Hubble flow on the absorption over such large distances will be at least twice the measured b(Ovi) = 33 km s^{−1}. The photoionization predictions for Ovi and Ne viii are thus physically unrealistic. The offset in the velocity centroid of the Ovi line and its higher b-value in comparision with the low and intermediate ionization species are clear indications of the multiphase gas composition. It is more likely that the Ovi and the Ne viii are regulated by collisional ionzation in a warm plasma at temperatures between ∼ 10^5 − 10^6 K. We discuss this possibility in the next section.

5.2. Collisional Ionization of Ovi and Ne viii in the Warm Gas

We can extract the temperature for the warm phase of the absorber from the measured value of N(Ne viii)/N(Ovi). In the simple collisional ionization models of Gnat & Sternberg (2007) shown in Figure 5, we find that the N(Ne viii)/N(Ovi) ∼ 1 is satisfied for gas temperatures of T ∼ 5.3 × 10^5 K. This temperature estimate is independent of the column density of H i in this phase, but assumes a solar ratio for (Ne/O) relative abundance. The temperature corresponds to a thermal line broadening of b_t(Ovi) ∼ 23 km s^{−1} which is consistent with the measured b(Ovi) = 33 ± 2 km s^{−1}, and indicates roughly equal contributions from thermal and non-thermal line broadening. The T ∼ 5.2×10^5 K will be a lower limit if we account for the possibility that the Ovi can have some contribution from the photoionized gas as well. The intermediate ions like C iii, Niii, N iv, O iii, and O iv have very low ionization fractions (f^<∼ 10^{−5}) at such temperatures and will contribute negligibly to the total column density.

The H i associated with the warm phase will be broad, dominated by its thermal b-value of ∼ 93 km s^{−1}. In other words, it will be a broad-Lyα absorber (BLA). The very low ionization fraction of f(H i) = N(H i)/N(H) = 5.85 × 10^{−7} would result in the BLA absorption being shallow. This broad component would fall on top of the strong and narrow absorption from the photoionized gas. There is some hint for the presence of such a component in the wings of the Lyα line between velocities of [-110, -75] km s^{−1} and [+75, +110] km s^{−1}. The S/N in this region is not adequate to clearly distinguish this feature. Nonetheless, as we show in figure 6, the observed Lyα profile is consistent with the presence of a broad component with b(H i) = 93 km s^{−1} and log N(H i)^<∼ 13.3 dex. This upper limit on the BLA column density corresponds to a lower limit of [X/H] >∼ − 0.3 on the true metallicity (see figure 5). The limiting BLA column density implies a total hydrogen column density of log N(H) ∼ 19.5 dex, a ∼ 2 orders of magnitude higher baryon column density compared to the cool photoionized gas. From this analysis, we conclude a log N(H i) = 13.09 (−0.6, +0.3) with O and Ne abundances of [X/H] ∼ −0.12 (−0.18, +0.12) in the warm collisionally ionized phase of the absorber.

5.3. A Constraint on the Broad-Lyα Absorption Tracing the Warm Gas

The metallicity in this warm phase of the absorber is not well constrained since we do not have a direct measure on the associated H i. If the warm gas is spatially coupled with the cooler photoionized gas, we can accept near-solar abundances for O and Ne as well. At solar metallicities and at T ∼ (2 − 7) × 10^5 K the metal cooling efficiencies can be high leading to recombination lags and shifts in ionization fractions of high ions from the collisional ionization equilibrium (CIE) predictions. However, as shown in Figure 5, the predictions from the non-equilibrium cooling models are similar to CIE. At solar metallicity, the single phase model would predict the measured N(Ne viii) and N(Ovi) for log N(H i) = 12.7 dex. Alternatively, one can place an upper limit on the H i column density, and a corresponding lower limit on the metallicity using the Lyα.

We applied a formal fit to the Lyα by fixing the two narrow components of the H i core (given in Table 3) and the velocity of the BLA at v = 0 km s^{−1} corresponding to the velocity centroid of the Ovi doublet lines. The fit yields a b(H i) = 86 ± 6 km s^{−1} and log [N(H i)] = 13.25 ± 0.17 dex. Considering the low detection significance of the BLA, the fitting procedure has underestimated the errors. The derived fit parameters are sensitive to the choice of the continuum and the assumptions on the component structure made on the basis of profile fitting. Regardless of this, it is interesting to note that the b from the best-fit model is comparable to the value expected for b(H i) from gas at T ∼ 5.2 × 10^5 K.

6. SUMMARY

We have added new insights into the gas phase properties of the z = 0.32566 Ne viii absorber with the help of HST /COS high S/N spectroscopic observations of 3C 263. The F USE detection of Ne viii was reported by Narayanan et al. (2009). The COS spectrum with coverage over the wavelength range of 1136 − 1796 Å shows lines from H i (Lyα to θ), Ovi, C iii, Niii, Si iii, C ii at z = 0.32566, in addition to useful upper limits from non-detections of Nii and Si ii. This is supplemented by archival F USE observations of O iii, O iv, N iv and Ne viii. The main conclusion is that the Ne viii combined with Ovi and possible broad H i in this absorber are diagnostic of collisionally ionized gas with T ∼ 5.3 × 10^5 K. The other significant results are summarized as follows:

1. The z = 0.32566 absorber is a multiphase mix of low ionization gas at T^<∼ 10^4 K and warm high ionization gas at T 5 × 10^5 K. Absorption in the low ionization gas shows at least two components at v ∼ −23 km s^{−1} and +12 km s^{−1} in the the higher order Lyman lines and in the C iii 977 Å line. The COS spectrum also shows Niii, Si iii, and C ii associated with the positive velocity component. The b-values of these intermediate and low ions are^<∼ 10 km s^{−1} implying low temperatures. The Ovi 1031, 1037 Å lines are a factor of ∼ 4 broader and are not kinematically aligned with the low, intermediate ions or the core of the H i profile.

2. The low and intermediate ions are consistent with an origin in gas photoionized by the extragalactic background radation. The bulk of the observed H i is also traced by this photoionized medium. Simple photoionization models predict the measured low and intermediate ion column densities for a log U ∼ −2.2 corresponding to a density of nH ∼ 5 × 10^{−4} cm^{−3}, and a total hydrogen column density of N(H) ∼ 2 × 10^{18} cm^{−2}. The abundances in the photoionized phase are [C/H] = 0 ± 0.04 dex, [N/H] = −0.3 ± 0.1, [O/H] = −0.8 ± 0.1 dex, and [Si/H] = −0.6 ± 0.3 dex.

3. The Ovi and Ne viii favor an origin in collisionally ionized gas. The N(Ovi) ∼ N(Ne viii) is predicted at T = 5.2 × 10^5 K in CIE and nonequilibrium cooling models. The H i absorption associated with this warm absorber is a BLA with b(H i) ∼ 93 km s^{−1} and comes from the trace neutral fraction (f(H i) = N(H i)/N(H) = 5.85 × 10^{−7}) of hydrogen. The BLA is only marginally detected in the COS spectrum. From the observed Ne viii, Ovi and the constraints set by the Lyα profile, we estimate for the warm gas phase a metallicity of [X/H] ∼ −0.12 (−0.18, +0.12), and a total hydrogen column density of N(H) = 3×10^{19} cm^{−2}. The warm absorber contains a factor of ∼ 2 dex more baryons than what is traced by the photoionized gas.

The ionization properties of the warm gas in this absorber are consistent with those predicted for the warm component of the WHIM, although the near-solar chemical abundances for carbon are higher than what is expected for the IGM. The absorber could be kinematically associated with halo gas. Without deep galaxy redshift measurements for the field surrounding 3C 263, it will be difficult to draw firm conclusions about the actual physical site of the absorption. In Table 5, we have summarized the properties of the currently known population of Ovi - Ne viii absorbers. Except for the sight line discussed in this paper, imaging data exists for all the other fields. In four out of the six remaining instances, relatively bright galaxies (0.01 − 1 L^∗) were found proximate (∼ 200 kpc) to the absorbers. This is consistent with the correlation of Ovi absorbers with galaxies (e.g., Wakker & Savage 2009), particularly their higher coveration fractions around galaxies that show evidence for star formation (Chen & Mulchaey 2009; Tumlinson et al. 2011b).

We note that there have been few detections of Ne viii - Ovi absorbers tracing T ∼ (0.5 − 1) × 10^6 K gas. One would expect an occasional imprint of the hot component of the WHIM in quasar spectra by way of absorbers with N(Ne viii) > N(Ovi) (see Figure 6). The apparent dearth of T ∼ 10^6 K Ne viii systems is puzzling, although the current statistics are small. A straightforward interpretation is that the Ne viii absorbers in the current sample are having a physical origin different from the filamentary structures of the WHIM outside the virial boundaries of galaxies. The near-solar abundances are consistent with their origin in the extended regions around galaxies. Galaxy simulations find that the inclusion of feedback from star-formation and AGNs can heat circumgalactic gas to the warm temperatures of the WHIM (Cen & Ostriker 2006; Tepper-García et al. 2012). In the simulations by Tepper-García et al. (2011), majority of halo Ovi absorbers are tracing such highmetallicity regions enriched by supernova driven outflows where the gas has started to radiatively cool from the post-shock temperatures of T^>∼ 10^6 K.

The multiphase mix of cool and warm gas phases found in the Ne viii - Ovi absorbers are also analogus to the highly ionized Milky Way high velocity clouds. The Ne viii could have an origin similar to Ovi in the interface layers between the T^<∼ 10^4 K high velocity gas and the T^>∼ 10^6 K coronal ISM surrounding the galaxies (Sembach et al. 2003; Fox et al. 2004, 2006). The properties of several extragalactic Ovi absorbers are found to be consistent with ionization in such conductive interfaces or mixing layers (Narayanan et al. 2010a; Savage et al. 2010, 2011; Tumlinson et al. 2011a; Tripp et al. 2011). The transition temperatures at the layers between the cold and hot phases would explain the narrow range in temperature probed by the current sample of Ne viii absorbers (see Table 5).

The high sensitivity spectra afforded by COS will possibly reveal many more Ne viii - Ovi warm absorbers in the low redshift universe. Understanding where those absorbers reside with respect to galaxies along with a measurement on their chemical abundances will be important while predicting the origin of the warm gas. High metallicties and proximity to galaxies would favor an origin for the Ne viii and Ovi in virialized halos rather than the canonical WHIM distant from galaxies.

This research is supported by the NASA Cosmic Origins Spectrograph program through a sub-contract to the University of Wisconsin-Madison from the University of Colorado, Boulder and NNX08-AC14G to the University of Colorado, Boulder. B.P.W. acknowledges support from NASA grant NNX-07AH426. The authors thank Jim Green & team for delivering the Cosmic Origins Spectrograph and the STS-125 team for its installation on the HST. AN is indebted to Srianand Raghunathan and Sowgat Muzahid for valuable discussions. We are grateful to Gary Ferland and collaborators for developing the Cloudy photoionization code. We also thank Orly Gnat for making the computational data on radiatively cooling models public. This research has made use of the NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration.

REFERENCES

Cen, R., & Ostriker, J. P. 1999, ApJ, 514, 1 Cen, R., & Ostriker, J. P. 2006, ApJ, 650, 560 Chen, H.-W., & Mulchaey, J. S. 2009, ApJ, 701, 1219 Danforth, C. W., & Shull, J. M. 2005, ApJ, 624, 555 Danforth, C. W., & Shull, J. M. 2008, ApJ, 679, 194 Danforth, C. W., Stocke, J. T., & Shull, J. M. 2010, ApJ, 710, 613 Davé, R., et al. 2001, ApJ, 552, 473 Ding, J., Charlton, J. C., Churchill, C. W., & Palma, C. 2003, ApJ, 590, 746 Ferland, G. J., Korista, K. T., Verner, D. A., Ferguson, J. W., Kingdon, J. B., & Verner, E. M. 1998, PASP, 110, 761 Fitzpatrick, E. L., & Spitzer, L., Jr. 1997, ApJ, 475, 623 Fox, A. J., Savage, B. D., Wakker, B. P., Richter, P., Sembach, K. R., & Tripp, T. M. 2004, ApJ, 602, 738 Fox, A. J., Savage, B. D., & Wakker, B. P. 2006, ApJS, 165, 229 Froning, C. S., & Green, J. C. 2009, Ap&SS, 320, 181 Green, J. C., Froning, C. S., Osterman, S., et al. 2012, ApJ, 744, 60 Gnat, O., & Sternberg, A. 2007, ApJS, 168, 213 Haardt, F., & Madau, P. 2001, Clusters of Galaxies and the High Redshift Universe Observed in X-rays.

Heckman, T. M., Sembach, K. R., Meurer, G. R., et al. 2001, ApJ, 554, 1021 Kereš, D., Katz, N., Weinberg, D. H., & Davé, R. 2005, MNRAS, 363, 2 Kriss, G. A. 2011, COS Instrument Science Report 2011-01(v1), 17 pages, 1, http://www.stsci.edu/hst/cos/documents/isrs/ Meiring, J. D., Tripp, T. M., Werk, J. K., et al. 2012, arXiv:1201.0939 Moos, H. W., Cash, W. C., Cowie, L. L., et al. 2000, ApJ, 538, L1 Narayanan, A., Wakker, B. P., & Savage, B. D. 2009, ApJ, 703, 74 Narayanan, A., Wakker, B. P., Savage, B. D., et al. 2010b, ApJ, 721, 960 Narayanan, A., Savage, B. D., & Wakker, B. P. 2010a, ApJ, 712, 1443 Narayanan, A., Savage, B. D., Wakker, B. P., et al. 2011, ApJ, 730, 15

Osterman, S., Green, J., Froning, C., et al. 2011, Ap&SS, 335, 257 Richter, P., Savage, B. D., Tripp, T. M., & Sembach, K. R. 2004, ApJS, 153, 165 Richter, P., Savage, B. D., Sembach, K. R., & Tripp, T. M. 2006, A&A, 445, 827 Sahnow, D. J., Moos, H. W., Ake, T. B., et al. 2000, ApJ, 538, L7 Savage, B. D., & Sembach, K. R. 1991, ApJ, 379, 245 Savage, B. D., Sembach, K. R., Tripp, T. M., & Richter, P. 2002, ApJ, 564, 631 Savage, B. D., Lehner, N., Wakker, B. P., Sembach, K. R., & Tripp, T. M. 2005, ApJ, 626, 776 Savage, B. D., Narayanan, A., Wakker, B. P., et al. 2010, ApJ, 719, 1526 Savage, B. D., Lehner, N., & Narayanan, A. 2011, ApJ, 743, 180 Sembach, K. R., Wakker, B. P., Savage, B. D., et al. 2003, ApJS, 146, 165 Stocke, J. T., Penton, S. V., Danforth, C. W., Shull, J. M., Tumlinson, J., & McLin, K. M. 2006, ApJ, 641, 217 Tepper-García, T., Richter, P., Schaye, J., et al. 2011, MNRAS, 413, 190 Tepper-García, T., Richter, P., Schaye, J., et al. 2012, arXiv:1201.5641 Tripp, T. M., & Savage, B. D. 2000, ApJ, 542, 42 Tripp, T. M., Sembach, K. R., Bowen, D. V., Savage, B. D., Jenkins, E. B., Lehner, N., & Richter, P. 2008, ApJS, 177, 39 Tripp, T. M., Meiring, J. D., Prochaska, J. X., et al. 2011, Science, 334, 952 Tumlinson, J., Werk, J. K., Thom, C., et al. 2011, ApJ, 733, 111 Tumlinson, J., Thom, C., Werk, J. K., et al. 2011, Science, 334, 948 Valageas, P., Schaeffer, R., & Silk, J. 2002, A&A, 388, 741 van de Voort, F., Schaye, J., Booth, C. M., Haas, M. R., & Dalla Vecchia, C. 2011, MNRAS, 414, 2458 Wakker, B. P., et al. 2003, ApJS, 146, 1 Wakker, B. P., & Savage, B. D. 2009, ApJS, 182, 378

TABLE 1 COS Observations of 3C 263

HST ID Obs.Date Grating FP-POS λ_c Δλ t_{exp} (yyyy:mm:dd) (Å) (Å) (sec)

LB6810010 2010-01-01 G130M 3 1291 1135 − 1427 3840 LB6810020 2010-01-01 G130M 3 1300 1145 − 1437 3840 LB6810030 2010-01-01 G130M 3 1309 1155 − 1446 3840 LB6810040 2010-01-01 G130M 3 1318 1165 − 1456 3840 LB6811020 2010-02-22 G160M 3 1589 1165 − 1459 4500 LB6811030 2010-02-22 G160M 3 1600 1147 − 1440 4500 LB6811040 2010-02-22 G160M 3 1611 1425 − 1782 4500 LB6811050 2010-02-22 G160M 3 1623 1437 − 1795 4500

Note. — Column (1) is the HST ID for the data set, column (2) gives the date of observation, column (3) lists the choice of grating, columns (4) and (5) are the the FP position and central wavelength of the grating, column (6) gives the wavelength range sampled under each setting and column (7) lists the duration of the exposure. All observations were done as part of the COS-GTO program ID 11541 (PI Green).

TABLE 2 AOD Measurements of Lines in COS Spectra

Line W_r b_a log [N_a (cm^{−2})] [−v, +v] (mÅ) (km s^{−1}) dex (km s^{−1})

H i 1215 > 453 51 ± 4 > 14.3 [-150,150] H i 1025 > 314 42 ± 4 > 15.0 [-150,100] H i 972 > 256 46 ± 5 > 15.3 [-150,100] H i 938 110 ± 8 37 ± 4 15.36 ± 0.04 [-75,75] H i 930 73 ± 6 37 ± 4 15.36 ± 0.03 [-75,75]

Ovi 1031 91 ± 9 37 ± 4 13.94 ± 0.05 [-75,75] Ovi 1037 52 ± 6 42 ± 7 13.96 ± 0.04 [-75,75]

C iii 977 179 ± 7 38 ± 4 13.60 ± 0.04 [-75,75] C iii 977 78 ± 9 18 ± 7 13.27 ± 0.04 [-75,-10] C iii 977 95 ± 10 26 ± 4 13.35 ± 0.04 [-10,75]

Niii 989 37 ± 10 27 ± 4 13.61 ± 0.05 [-10,75] Niii 989 < 48 ... < 13.1 [-75,-10]

Si iii 1206 74 ± 7 30 ± 3 12.64 ± 0.09 [-40, 40] Si iii 1206 49 ± 7 17 ± 3 12.46 ± 0.05 [-10,40] Si iii 1206 27 ± 7 17 ± 3 12.17 ± 0.08 [-40,-10]

C ii 903a 24 ± 6 14 ± 3 13.07 ± 0.05 [-15,30] C ii 903b 17 ± 5 15 ± 2 13.17 ± 0.07 [-15,30] C ii 1036 16 ± 6 13 ± 3 13.18 ± 0.07 [-15,30] C ii 1036 < 15 ... < 13.1 [-75,-10]

Nii 1083 < 12 ... < 13.0 [-75,75]

Si ii 1193 < 28 ... < 12.8 [-75,75]

Note. — The AOD integrations were performed over the velocity range over which absorption is seen. The Lyα, Lyβ and Lyγ have saturated line cores and the measurements are therefore lower limits. The C iii 977 Å and Si iii 1206 Å lines have a two component profile. The AOD measurements were done over the full absorption as well as the positive and negative velocity components. Niii, and C ii show absorption only in the positive velocity component. We have listed 3σ upper limits for the negative velocity component. The C ii λ = 903.9616 Å (f_{osc} = 0.336) transition is labelled as C ii 903a and the λ = 903.6235 Å (f_{osc} = 0.168) transition as C ii 903b. Nii and Si ii are not detected at the > 3σ level.

TABLE 3 Profile Fit Measurements of Lines in COS Spectra

Line v log [N (cm^{−2})] b χ^2_ν (km s^{−1}) dex (km s^{−1}) Lyα, β, γ, ϵ, ζ, η, θ −28 ± 4 ± 8 14.99 ± 0.04 18 ± 3 1.14 7 ± 3 ± 8 15.20 ± 0.04 17 ± 3 Lyα, β, γ, ϵ, ζ, η, θ −23 15.13 ± 0.05 21 ± 2 1.17 12 15.09 ± 0.05 15 ± 3

C iii 977 −23 ± 2 ± 8 13.45 ± 0.05 12 ± 2 0.56 12 ± 2 ± 8 13.67 ± 0.09 9 ± 3

C ii 903a 13 ± 2 ± 8 13.23 ± 0.05 10 ± 3 0.40

C ii 903b 13 ± 2 ± 8 13.30 ± 0.08 6 ± 3 0.30

C ii 1036 13 ± 1 ± 8 13.24 ± 0.07 6 ± 3 0.63

C ii 903a,903b,1036 13 ± 2 ± 8 13.26 ± 0.03 8 ± 2 0.53

Niii 989 12 ± 1 ± 8 13.75 ± 0.04 8 ± 2 0.52

Ovi 1032/1038 1 ± 1 ± 8 13.98 ± 0.05 33 ± 2 0.53

Si iii 1206 16 ± 2 ± 8 12.76 ± 0.29 5 ± 3 0.99 −20 ± 4 ± 8 12.18 ± 0.10 12 ± 3

Note. — The velocity uncertainty includes the statistical errors computed by the fitting routine and a ± 8 km s^{−1} velocity calibration error in the COS spectrum. The H i parameters were obtained from a simultaneous free-fit to the various uncontaminated Lyman series lines. The reduced-χ^2 of the fit is affected by the wavelength calibrations errors in the spectrum. A simultaneous fit on H i was also done by locking the velocity centroids of the components to the velocities in the C iii 977 Å absorption. The fit parameters from this and the free-fit are within 2σ of each other. The C ii λ = 903.9616 Å (f_{osc} = 0.336) transition is labelled as C ii 903a and the λ = 903.6235 Å (f_{osc} = 0.168) as C ii 903b. Simultaneous fits were done for the C ii multiplet lines and the Ovi 1031, 1037 Å doublet lines.

TABLE 4 AOD Measurements of Lines in F USE Spectra

Line W_r b_a log [N_a (cm^{−2})] [−v, +v] (mÅ) (km s^{−1}) dex (km s^{−1})

O ii 834 < 47 ... < 13.8 [-75,75]

O iii 833 42 ± 9 23 ± 6 13.89 ± 0.07 [-75,-10] O iii 833 51 ± 8 22 ± 11 14.00 ± 0.06 [-10,75]

O iv 788 41 ± 7 25 ± 8 13.93 ± 0.06 [-75,-10] O iv 788 34 ± 8 17 ± 9 13.85 ± 0.07 [-10,75]

N iv 765 45 ± 10 27 ± 4 13.23 ± 0.08 [-75,-10] N iv 765 30 ± 8 31 ± 4 13.10 ± 0.08 [-10,75]

Ne viii 770 34 ± 11 27 ± 7 13.87 ± 0.08 [-75,-10] Ne viii 770 20 ± 10 37 ± 6 13.40 ± 0.14 [-10,75] Ne viii 770 52 ± 11 52 ± 7 13.99 ± 0.11 [-75,75]

Note. — The F USE data has lower S/N compared to COS and therefore the component sub-structure seen in the COS absorption lines for this system are not evident. For the purpose of modeling we have split the integration range of N_a(v) into two regions corresponding to the velocities of the two components in H i and C iii seen in the COS spectrum.

TABLE 5 Properties of Known Ovi-Ne viii Intervening Absorbers

QSO z log N(Ovi) log N(Ne viii) log T log N(H) [X/H] Assoc. Galaxy Note

HE 0226-4110 0.2070 14.37 ± 0.03 13.89 ± 0.11 5.70 ∼ 20.1 ∼ −0.9 109 kpc, 0.25 L^∗ 1 PKS 0405-123 0.4951 14.39 ± 0.01 13.96 ± 0.06 5.72 ∼ 19.7 ∼ −0.6 110 kpc, 0.08 L^∗ 2 PG 1148+549 0.6838 14.47 ± 0.03 13.98 ± 0.09 5.68 ∼ 19.8 > −0.5 ... 3 0.7015 14.29 ± 0.04 13.75 ± 0.07 5.69 ∼ 19.2^>∼ 0 ... 3 0.7248 13.84 ± 0.10 13.70 ± 0.12 5.72 ∼ 18.8^>∼ 0 217 kpc, L^∗ 3 3C 263 0.3257 13.98 ± 0.05 13.99 ± 0.11 5.72 ∼ 19.3^>∼ − 0.1 ... 4 PG 1206+459 ∼ 0.927 ... ∼ 14.9 ∼ 5.6 ∼ 19.8^>∼ 0 68 kpc, 1.8 L^∗ 5

Note. — (1) From Savage et al. (2011); the abundance listed is for oxygen. (2) From Narayanan et al. (2011); the abundance listed is for neon; the total hydrogen column density was found to be in the range 19 − 20 dex. (3) The z = 0.6838 and z = 0.7015 absorbers in Meiring et al. (2012) have no associated galaxies detected down to m_U < 27. (4) This paper; there is no galaxy information available for this sightline. (5) The absorption has several components kinematically spread over ∼ 1450 km s^{−1}. The Ne viii column density listed is the total column density from all the components as given in Tripp et al. (2011). The temperature, metallicity and information on the galaxy are based on Tripp et al. (2011). The Ovi lines are covered only in the lower resolution (FWHM ∼ 230 km s^{−1}) HST /FOS spectrum and reported in Ding et al. (2003). The absorption is very strong [W_r(Ovi 1032) ∼ 0.5 Å], but there are no column density measurements because of various line contamination issues.

Fig. 1a – Continuum normalized COS and F USE spectra of 3C 263 where v = 0 km s^{−1} corresponds to z = 0.32566. Features which are not part of the absorption system are marked ”x” in the corresponding panels. The AOD and profile fit line measurements are listed in Tables 2 & 3. The Ly-δ (H i 950) line is contaminated by Galactic Si ii 1260 and possibly also by Sii 1260. The C ii lines at λ = 903.9616 Å and 903.6235 Å are labelled as C ii 903a and C ii 903b respectively.The Nii 1084 and Si ii 1193 transitions covered by COS and O ii 834 transition covered by F USE are not detected at ≥ 3σ significance.

Fig. 1b – Continuation of Figure 1a.

Fig. 2.— Continuum normalized COS spectrum of 3C 263 of the v = 0.32566 absorber with Voigt

profile models superimposed on the different lines. The fit parameters for the lines are given in Table 3. The vertical tick marks above each line represents the velocity centroid of the absorbing component. In the higher S/N COS spectrum, the H i lines and C iii clearly show a two component structure. Coincident with the positive velocity component are also seen absorption from Niii, Si iii, and C ii. The negative velocity component of Si iii is a weak feature. The Ovi 1031, 1037 lines are offset in velocity compared to the low ions. The Ovi profiles are consistent with absorption from a single component which is ∼ 4 broader in comparison with the low ions.

Fig. 3.— The top panel shows the apparent column density comparison between C ii 904a (λ = 903.9616 Å, f_{osc} = 0.336), C ii 904b (λ = 903.6235 Å, f_{osc} = 0.168) and C ii 1036 (λ = 1036.3367 Å, f_{osc} = 0.1231) transitions. The N_a(v) comparison suggests that the lines are unresolved at the FWHM ∼ 17 km s^{−1} resolution of COS and are narrower than the observed line widths. The N_a(C ii) when corrected for this instrumental blurring is consistent with the profile fit value given in Table 3. In the middle panel we see the kinematic coincidence between the two component absorption in C iii and H i. The component structure in H i is evident only in the unsaturated higher order Lyman lines. The C ii line aligns with the positive velocity component in C iii and H i. The similar N_a(v) profiles of Ovi 1031, 1037 lines shown in the bottom panel indicates the absence of contamination or unresolved saturation. The Ovi lines are kinematically broader and different compared to C iii or C ii.

Fig. 4.— Photoionization model predicted column densities for the positive velocity component of the z = 0.32566 absorber detected

in H i, C iii, Niii, Si iii, C ii by COS and in O iii, O iv and N iv by F USE. The bottom X-axis is the ionization parameter log U, and the top X-axis is the total hydrogen number density log [nH cm^{−3}]. The extragalactic ionizing background is from the Haardt & Madau (2001) model for z = 0.32566. The background includes UV photons from quasars and young star-forming galaxies. The acceptable range of column densities for each ion are highlighted in the photoionization curves using thick lines. O ii, Nii and Si ii are non-detections at the ≥ 3σ significance level and the corresponding column density measuremenets are upper limits. The models are constructed for a log N(H i) = 15.20 dex obtained from the profile fitting of H i lines. The shaded box represents the range of log U within which the values for photoionization models are a good match to the observed column densities of the low ions. To produce the observed column densities of the high ions (Ovi, Ne viii) from photoionization requires physically unrealistic scenarios. The results are discussed in detail in Sec 5.

Fig. 5.— Left Panel : Collisional ionization equilibrium (red curve) and non-equilibrium (blue curve) cooling model predictions for

the column density ratio between Ne viii and Ovi for a range of plasma temperatures, based on Gnat & Sternberg (2007). The horizontal dash-dot line is the measured N(Ne viii)/N(Ovi) and the vertical line is the temperature at which the model predictions match this ratio. The predictions from CIE and non-CIE models are identical for this temperature. Right Panel : Column densities for Ne viii and Ovi as a function of temperature from CIE models. For the models to reproduce the N(Ne viii) and N(Ovi) at log T = 5.72 (T = 5.2 × 10^5 K) at solar metallicity, the column density of H i has to be log N(H i) = 12.7 dex. This can be considered as a lower limit on the H i column density, assuming that this warm phase cannot have supersolar metallicities.

Fig. 6.— The top panel shows the Lyα line in the z = 0.32566 absorber with the profile model (blue)

superimposed. The model was obtained by simultaneously fitting Lyα and six higher order Lyman series lines in the COS spectrum. The best-fit model has two components of approximately equal N and b-values at v = −28 ± 4 km s^{−1} and v = 7 ± 3 km s^{−1}. The location of these components are marked by the vertical ticks. The fit parameters are given in Table 3. In the middle and bottom panels are shown the cumulative Lyα profile obtained when a BLA of b(H i) = 93 km s^{−1} and log[N(H i)] = 13.0 dex and 13.3 dex respectively is added to the absorption at v = 0 km s^{−1}. The BLA profile is shown by the red curve. The width of the BLA is set by the temperature derived for the measured N(Ne viii)/N(Ovi) from collisional ionization models. From the cumulative three component model, we can constrain log N(H i) ∼ 13.2 dex in the BLA.