arXiv:1203.2084v1 [astro-ph.CO] 9 Mar 2012

Mon. Not. R. Astron. Soc. 000, 1–17 (2012) Printed 5 February 2016 (MN L^ATEX style file v2.2)

BLR kinematics and Black Hole Mass in Markarian 6

V. T. Doroshenko,^{1,2,3⋆} S. G. Sergeev,^{1,3⋆} S. A. Klimanov,^4 V. I. Pronik,^{1,3} Yu. S. Efimov^1†

1Crimean Astrophysical Observatory, P/O Nauchny Crimea 98409, Ukraine 2Crimean Laboratory of the Sternberg Astronomical Institute, P/O Nauchny, 98409 Crimea, Ukraine 3Isaak Newton Institute of Chile, Crimean Branch, Ukraine 4Central Astronomical Observatory of Pulkovo, Pulkovskoe Shosse 65, 196140 St. Petersburg, Russia

Accepted . Received ; in original form

ABSTRACT

We present results of the optical spectral and photometric observations of the nucleus of Markarian 6 made with the 2.6-m Shajn telescope at the Crimean Astrophysical Observatory. The continuum and emission Balmer line intensities varied more than by a factor of two during 1992–2008. The lag between the continuum and Hβ emission line flux variations is 21.1 ± 1.9 days. For the Hα line the lag is about 27 days but its uncertainty is much larger. We use Monte-Carlo simulation of the random time series to check the effect of our data sampling on the lag uncertainties and we compare our simulation results with those obtained by random subset selection (RSS) method of Peterson et al. (1998). The lag in the high-velocity wings are shorter than in the line core in accordance with the virial motions. However, the lag is slightly larger in the blue wing than in the red wing. This is a signature of the infall gas motion. Probably the BLR kinematic in the Mrk 6 nucleus is a combination of the Keplerian and infall motions. The velocity-delay dependence is similar for individual observational seasons. The measurements of the Hβ line width in combination with the reverberation lag permits us to determine the black hole mass, M_{BH} = (1.8 ± 0.2) × 10^8M⊙. This result is consistent with the AGN scaling relationships between the BLR radius and the optical continuum luminosity (R_{BLR} ∝ L^{0.5}) as well as with the black-hole mass–luminosity relationship (M_{BH} − L) under the Eddington luminosity ratio for Mrk 6 to be L_{bol}/L_{Edd} ∼ 0.01.

Key words: galaxies: active – galaxies: nuclei – galaxies: Seyfert – galaxies: individual: Mrk 6

1 INTRODUCTION

Over the past nearly 30 years the method of reverberation mapping (RM) (Peterson 1988 and reference therein) has become one of the standard methods for studying the Active Galactic Nuclei (AGNs). It is based on the assumption that in a typical Seyfert galaxy the source of continuous radiation near a black hole, named as accretion disc (AD), is expected to be of order 10^{13} − 10^{14} cm. Photoionization of the gas located at a distance of order 10^{16} cm produces broad emission lines. The relationship between the continuum and emission line fluxes can be represented by the equation (Blandford & McKee 1982)

⋆ E-mail: vdorosh@sai.crimea.ua (VTD); sergeev@crao.crimea.ua (SGS). † Deceased, 2011 October 21.

L(t) = ∫ Ψ(τ )C(t − τ )dt, where C(t) and L(t) are the observed continuum and emission-line light curves, and Ψ(τ ) is the 1-d transfer function (TF). The TF determines the emission line response to a δ-function continuum pulse as seen by a distant observer. So, the emission lines ”echo” or ”reverberate” in response to the continuum changes with a delay τ . The size of the region where broad lines (BLR) are formed can be written as RBLR = cτ . The primary task of the RM method is to use the observable C(t) and L(t) to solve the above integral equation for the TF in order to obtain information about the geometry and physical conditions in the BLR. Unfortunately, it is very difficult to find a unique and reliable solution to this equation. However, it is possible to find a temporal shift (lag) between the continuum and emission line light curves using the cross-correlation analysis.

© 2012 RAS

2 V. T. Doroshenko et al.

Applying the virial assumption, the mass of the black hole can be determined when the BLR size and the velocity dispersion of the BLR gas are known (Peterson et al. 2004). The present tremendous progress being made in black hole mass estimates can be attributed to the reverberation method.

On the other hand, different segments of a single emission line seem to be formed at different effective distances from the ionizing source. In that case, the response in the flux of emission line at line-of-sight velocity Vr and time delay τ is caused by the 2-d transfer function or ”velocity delay map” (Horne et al. 2004). The reverberation technique applied to different parts of a single emission line allows one to make conclusions about the velocity field of the BLR gas. To the present time, considerable progress was made in understanding the direction of the BLR gas motion (Gaskell 2009; Bentz et al. 2008; Denney et al. 2009; Bentz et al. 2010). For example, some distinctive signatures for infalling gas motions in NGC 3516 and Arp 151 (Bentz et al. 2009b; Denney et al. 2009) were revealed: the blue side of the line lagging the red side. NGC 5548 shows the virialized gas motions with the symmetric lags on both the red and blue sides of line. However, the BLR gas in NGC 3227 shows the signature of radial outflow: shorter lags for the blue-shifted gas and longer lags for the red-shifted gas (Denney et al. 2009).

More than 40 AGNs have been studied by the RM up to now (Peterson et al. 2004; Bentz et al. 2009b; Denney et al. 2010). However, the Mrk 6 nucleus is absent in this list. Just a few studies of this galaxy have been made by the reverberation method. We can mention the paper by Doroshenko & Sergeev (2003) based on the archive spectra of Mrk 6 obtained from 1970–1991 using the image tube spectrograph at the 2.6-m telescope of the Crimean Astrophysical Observatory (CrAO). There is also another paper by Sergeev et al. (1999) that includes the results of the 1992–1997 observations with the same spectrograph but with a CCD detector. In this paper a lag in the flux variations of hydrogen lines with respect to the adjacent continuum flux variations was reported for the first time and changes in the line profiles were studied.

Mrk 6 is a Seyfert 1.5 galaxy (Sy 1.5). This galaxy was one of the first galaxies in which the strong variability of the Hβ emission line profile was detected by Khachikian & Weedman (1971). Although there have not been many optical observations of Mrk 6, there are some radio studies of Mrk 6 available (Kukula et al. 1996; Kharb et al. 2006), which revealed the complex structure of the radio emission. The X-ray emission from the Mrk 6 nucleus (Feldmeier et al. 1999; Malizia et al. 2003; Immler et al. 2003; Schurch et al. 2006) exhibits a complex X-ray absorption and some authors assume that the BLR is a possible location of this absorption complex (Malizia et al. 2003).

In this paper we present the results of our optical spectroscopic observations of Mrk 6 during the monitoring campaign from 1998 to 2008 performed after publishing our earlier papers with observations made from 1970–1997. For completeness we apply our analysis to all the spectral CCD observations that have been made since 1992 and we also use the results of our photometric observations in the V band. Throughout the entire work, we take z = 0.01865 from our spectral estimates, the distance to Mrk 6 equal to

D = 81 Mpc, and H0 =70 km s^{−1} Mpc^{−1}. The observations and data reduction are described in Section 2. We present the cross-correlation analysis in Section 3, the line width measurements in Section 4; the estimates of the black hole mass, the mass–luminosity and lag–luminosity diagrams are presented in Sections 5 and 6, the velocity-resolved reverberation lag analysis is performed in Section 7. The results are summarized in Section 8.

2 OBSERVATIONS

2.1 Spectral observations and data processing

The Hα and Hβ spectra of the Seyfert galaxy Mrk 6 were obtained from the CrAO 2.6-m Shajn telescope. Prior to 2005 we used the Astro-550 CCD which had a size 580×520 pixels and was cooled by liquid nitrogen. The dispersion was 2.2 Å pixel^{−1}, and the spectral resolution was about 7–8 Å. The working wavelength range was about 1200 Å. The entrance slit width was 3^{′′}. For technical reasons it was not always possible to set the same position angle (PA) of the entrance slit. Most of the observations were performed along PA∼ 125^o or PA∼ 90^o . The typical exposure time was about one hour. The ”extraction window” was equal to 11^{′′} .

In July 2005 the Astro-550 CCD was replaced with the SPEC-10 1340 × 100 pixel CCD, thermoelectrically cooled up to −100^o C. In this case the dispersion was 1.8 Å pixel^{−1}. A 3.^{′′} 0 slit with a 90^∘position angle was utilized for these observations. The higher quantum efficiency (95% max.) and the lower read noise of this CCD allowed us to obtain higher quality spectra under shorter exposure times. The spectral wavelength range for these data sets was about 2000 Å near the Hα and Hβ regions. However, the red and blue edges of the CCD frame are unusable because of vignetting. Generally, all spectra in both spectral regions were obtained with a single exposure during the whole night. Our final data set for 1998–2008 consists of 135 spectra in the Hβ region and 48 spectra in Hα. The mean signal-to-noise ratio (S/N) is equal to 32 for the Astro-550 and 73 for the SPEC-10 in the Hβ region and is equal to 40 and 66 in the Hα region, respectively.

As a rule, each observation was preceded by four shorttime (∼10 s) exposures of the standard star BS 3082, whose spectra were obtained at approximately the same zenith distance as that of the galaxy. The spectral energy distribution for these spectra was taken from Kharitonov et al. (1988). The standard star spectra were used to remove telluric absorption features from the spectra of Mrk 6, to provide the relative flux calibration, and to measure the seeing parameter defined as the FWHM of the cross-dispersion profile on the CCD image. The description of the primary data processing as well as some details of absolute calibration and measurements of the spectra are given in Sergeev et al. (1999).

The flux calibration was carried out by assuming the narrow emission line fluxes to be constant. We chose the narrow [OIII]λ5007 (for the Hβ region) and [SII]λλ6717, 6732 emission lines (for the Hα region) as the internal flux standards. Their absolute fluxes were measured from the spectra obtained under photometric conditions by using the spectra of the comparison star BS 3082. The

Black Hole Mass in Mrk 6 3

Figure 1. Mean Mrk 6 spectrum obtained by combining the quasi-simultaneous pairs of spectra from the Hα and Hβ spectral regions (SPEC-10 CCD only).

mean fluxes in these lines are given in Sergeev et al. (1999): F([OIII]λ5007)=(6.90 ± 0.11) × 10^{−13} erg s^{−1} cm^{−2}; F[SII] λλ(6717 + 6731)=(1.61±0.09) × 10^{−13} erg s^{−1} cm^{−2}, and F[OI] λ6300=(0.597±0.035) × 10^{−13} erg s^{−1} cm^{−2}. The [SII] lines reside on the far wings of the broad Hα line. Thus, to measure their fluxes, we selected the pseudo-continuum zones closely spaced around each line. The line fluxes were measured by integrating the spectra over the specified wavelength intervals and above the continuum (or local pseudocontinuum), which was fitted with a straight line in the selected zones. The mean continuum flux per unit wavelength was determined in two windows: at 5162–5186 Å (designated as F 5170) and 6985–7069 Å (designated as F 7030). The continuum zones and integration limits are the same as in Sergeev et al. (1999). The line and continuum flux uncertainties contain errors related to the S/N of the source spectra, atmospheric dispersion, changes in the position angle of the slit, and seeing effects. Evaluation of these uncertainties is considered in Sergeev et al. (1999). The mean spectrum of Mrk 6 produced by combining 23 quasi-simultaneous pairs of spectra from the Hα and Hβ regions is shown in Fig.1. Figure 2 shows the mean and rms spectra of Mrk 6 based on our observations in 1992–2008.

2.2 Optical photometry

In order to improve the time resolution of our data set in the F5170 continuum we added the V -band photometry to our spectral observations. Photometric data came from two sources: the UBV observations were made at the Crimean Laboratory of the Sternberg Astronomical Institute of Moscow University, and the BV RI observations were obtained at the CrAO. The UBV observations were obtained in the standard Johnson photometric system and were carried out from 1986 to 2009 at the 60-cm Zeiss telescope with a photo-multiplier detector through the aperture A=27.^{′′}5. The mean uncertainty of Mrk 6 in the V -band is 0.^m022. These data were partially published by Doroshenko (2003).

In 2001 we started regular observations of Mrk 6 using the CrAO 70-cm AZT-8 telescope and the AP7p CCD. The CCD field covers 15^′×15^′. Photometric fluxes were measured within an aperture of 15.^{′′} 0. The mean uncertainty of the

Figure 2. Mean and rms spectra of Mrk 6 in the Hβ region from our observations 1992–2008.

V -band CCD observations is 0.^m009. Further details about the instrumentation, reductions, and measurements of the BV RI photometric data can be found in Doroshenko et al. (2005). These data were partially published by Sergeev et al. (2005).

2.3 Light curves

Light curves in Hα and Hβ, and the adjacent continuum are shown in Fig. 3 for spectral observations corrected for seeing. The continuum light curves obtained from the photometric V -band observations were scaled to the flux density measured from the spectroscopic observations. To this end, we used the observations made on the same nights almost simultaneously. We have 29 appropriate observational nights at the 2.6-m and 70-cm telescopes (spectra plus CCD photometry) and 40 appropriate nights at the 2.6-m and 60-cm telescopes (spectra plus the UBV photoelectric photometry). The correlation coefficient between the spectral continuum and the V -band CCD flux for the appropriate nights is r=0.984 (n=29 points), and the correlation coefficient between the spectral continuum and the V -band flux from the UBV observations is r=0.993 (n=40 points). Using the regression equations, we converted our V -band photometric fluxes to the spectral continuum fluxes (F5170). For the nights where both spectral and photometric observations were available, the continuum fluxes are calculated as the weighted average. The fluxes were not corrected for the host starlight contamination and Galactic reddening.

Tables 1 and 2 give the light curves from the spectral observations for 1998–2008 (the data for 1991–1997 are available in Sergeev et al. 1999). The Hβ and Hγ line fluxes together with the spectral continuum fluxes F5170 are shown in Table 1. The Hα line fluxes and the spectral continuum fluxes F7030 are shown in Table 2. Table 3 gives combined continuum fluxes from both the spectral observations and from V -band photometric measurements for 1991–

4 V. T. Doroshenko et al.

Figure 3. Light curves of Mrk 6 shown for the continuums and Hα, Hβ, and Hγ lines. Narrow lines were not subtracted from the fluxes. Bottom panel shows the merged continuum light curve used for cross-correlation analysis. Units are 10^{−13} erg cm^{−2} s^{−1} and 10^{−15} erg cm^{−2} s^{−1} Å^{−1} for the lines and continua, respectively. The vertical dash-dotted lines show the boundaries of the five time intervals considered in the present paper.

2008. All the fluxes are seeing-corrected. These light curves have been used for the subsequent time-series analysis.

Bottom panel in Figure 3 shows the combined light curve from different telescopes. The combined light curve shows long time scale continuum variability in Mrk 6 as well as more rapid random changes. The flux maxima were observed in 1995–1996 and in 2007.

Statistical parameters of the light curves for the lines and continuum are listed in Table 4. Column 1 gives the spectral features; column 2 gives a number of data points; column 3 is the median time interval between the data points. The combined continuum light curve is sampled better than the Hβ light curve, the Hβ light curve is sampled better than Hα. The mean flux and standard deviation are given in columns 4 and 5, and column 6 lists the variance Fvar calculated as the ratio of the rms fluctuation, corrected for the effect of measurement errors, to the mean flux. Rmax in column 7 is the ratio between the maximum and minimum fluxes corrected for the measurement errors. Uncertainties in Fvar and Rmax were computed assuming that a light curve is a set of statistically dependent values, i.e., a random pro-

Table 1. F5170 spectral continuum, the Hβ and Hγ line fluxes.

JD-2,440,000 F 5170 Hβ Hγ

10869.449 5.932 ± 0.057 3.980 ± 0.079 – 10875.449 6.279 ± 0.087 3.987 ± 0.093 – 10876.379 6.365 ± 0.085 4.082 ± 0.112 – 10905.395 6.451 ± 0.057 4.420 ± 0.080 – 10906.273 6.352 ± 0.088 4.329 ± 0.098 – 10924.432 5.684 ± 0.079 4.511 ± 0.085 – 10966.379 5.008 ± 0.058 3.476 ± 0.065 – 10982.395 5.570 ± 0.101 3.792 ± 0.096 – 10994.387 5.678 ± 0.062 4.072 ± 0.085 – 11014.516 5.302 ± 0.091 3.971 ± 0.094 – 11052.563 5.519 ± 0.081 3.724 ± 0.100 – 11074.574 5.665 ± 0.064 3.939 ± 0.086 – 11076.516 5.628 ± 0.080 4.022 ± 0.078 – 11085.570 6.117 ± 0.066 4.102 ± 0.087 – 11100.512 6.344 ± 0.076 4.283 ± 0.079 – 11141.406 5.155 ± 0.087 4.316 ± 0.087 – 11218.281 5.525 ± 0.117 4.022 ± 0.133 – 11278.395 6.743 ± 0.074 4.795 ± 0.103 – 11281.383 6.927 ± 0.087 4.687 ± 0.099 – 11290.402 5.878 ± 0.187 4.668 ± 0.201 – 11310.289 5.216 ± 0.067 4.594 ± 0.090 – 11319.313 4.817 ± 0.063 4.276 ± 0.086 – 11322.305 5.134 ± 0.148 3.885 ± 0.113 – 11349.324 4.884 ± 0.084 3.615 ± 0.078 – 11485.504 5.096 ± 0.072 4.438 ± 0.089 – 11497.434 5.160 ± 0.086 4.141 ± 0.113 – 11516.551 5.103 ± 0.073 4.020 ± 0.078 – 11557.418 4.465 ± 0.077 3.188 ± 0.098 – 11577.406 4.456 ± 0.066 3.151 ± 0.087 – 11587.293 4.514 ± 0.070 3.119 ± 0.079 – 11606.383 4.821 ± 0.112 3.192 ± 0.127 – 11608.285 4.540 ± 0.089 3.187 ± 0.094 – 11615.340 5.173 ± 0.114 3.081 ± 0.108 – 11636.270 5.252 ± 0.076 3.561 ± 0.084 – 11707.402 5.783 ± 0.095 3.687 ± 0.092 – 11720.336 5.875 ± 0.069 3.671 ± 0.087 – 11780.555 5.757 ± 0.102 4.052 ± 0.123 – 11782.555 5.868 ± 0.080 3.989 ± 0.101 – 11791.531 5.385 ± 0.093 4.017 ± 0.126 – 11810.531 5.463 ± 0.075 3.751 ± 0.097 – 11821.582 5.010 ± 0.092 4.032 ± 0.094 – 11823.496 5.049 ± 0.072 4.068 ± 0.097 – 11838.508 5.234 ± 0.183 3.741 ± 0.181 – 11840.539 5.027 ± 0.103 3.574 ± 0.111 – 11844.496 4.679 ± 0.072 3.577 ± 0.098 – 11847.473 4.688 ± 0.089 3.433 ± 0.116 – 11853.582 4.628 ± 0.067 3.456 ± 0.089 – 11869.496 5.184 ± 0.073 3.363 ± 0.082 – 11878.449 5.012 ± 0.080 3.450 ± 0.102 – 11901.316 5.436 ± 0.106 3.354 ± 0.123 – 11926.270 4.391 ± 0.084 3.374 ± 0.080 – 11959.227 4.689 ± 0.129 3.360 ± 0.151 – 11999.270 4.517 ± 0.112 3.077 ± 0.103 – 12030.422 5.191 ± 0.100 3.149 ± 0.105 – 12050.465 4.689 ± 0.087 3.219 ± 0.081 – 12104.316 4.394 ± 0.069 2.805 ± 0.079 – 12174.539 4.327 ± 0.069 3.007 ± 0.087 – 12175.531 4.153 ± 0.084 3.094 ± 0.087 – 12192.551 4.046 ± 0.095 3.099 ± 0.104 – 12201.598 3.845 ± 0.105 2.994 ± 0.133 – 12223.543 4.004 ± 0.085 2.934 ± 0.107 – 12323.375 3.899 ± 0.054 2.424 ± 0.063 – 12343.473 3.573 ± 0.107 2.723 ± 0.118 –

Black Hole Mass in Mrk 6 5

Table 1 – continued F5170 spectral continuum, the Hβ and Hγ line fluxes.

JD-2,440,000 F 5170 Hβ Hγ

12381.262 4.039 ± 0.125 2.356 ± 0.130 – 12441.359 5.067 ± 0.078 3.406 ± 0.082 – 12613.543 5.260 ± 0.085 3.500 ± 0.099 – 12619.543 5.285 ± 0.063 3.457 ± 0.075 – 12675.410 5.032 ± 0.106 2.854 ± 0.126 – 12914.605 5.412 ± 0.152 3.171 ± 0.156 – 12915.531 5.223 ± 0.067 3.445 ± 0.092 – 13089.324 4.197 ± 0.062 2.682 ± 0.066 – 13097.301 4.849 ± 0.205 2.603 ± 0.111 – 13319.496 3.639 ± 0.065 2.741 ± 0.055 – 13356.555 3.175 ± 0.060 2.219 ± 0.068 – 13611.563 6.791 ± 0.081 4.125 ± 0.075 1.342 ± 0.057 13612.553 6.812 ± 0.062 4.135 ± 0.058 1.368 ± 0.046 13621.523 6.877 ± 0.082 4.264 ± 0.079 1.417 ± 0.064 13641.566 6.279 ± 0.096 4.197 ± 0.078 1.347 ± 0.069 13647.570 6.158 ± 0.095 4.157 ± 0.075 1.260 ± 0.062 13648.594 6.310 ± 0.084 4.156 ± 0.077 1.332 ± 0.069 13649.559 6.276 ± 0.081 4.082 ± 0.073 1.277 ± 0.063 13670.555 6.284 ± 0.083 4.020 ± 0.068 1.317 ± 0.060 13676.583 6.309 ± 0.079 3.914 ± 0.065 1.235 ± 0.055 13698.469 6.366 ± 0.103 4.038 ± 0.081 1.255 ± 0.067 13774.453 5.677 ± 0.189 4.203 ± 0.114 1.290 ± 0.104 13788.344 5.997 ± 0.091 4.044 ± 0.067 1.269 ± 0.058 13830.238 6.715 ± 0.113 3.949 ± 0.086 1.206 ± 0.070 13875.332 7.178 ± 0.086 4.282 ± 0.086 1.264 ± 0.071 13994.566 7.272 ± 0.080 4.269 ± 0.077 1.326 ± 0.062 14013.613 7.496 ± 0.089 4.407 ± 0.087 1.317 ± 0.066 14038.555 7.741 ± 0.089 4.177 ± 0.086 1.227 ± 0.073 14048.566 7.806 ± 0.136 4.069 ± 0.100 1.085 ± 0.082 14064.551 7.001 ± 0.085 4.244 ± 0.081 1.116 ± 0.057 14065.617 6.963 ± 0.079 4.139 ± 0.075 1.195 ± 0.063 14076.461 6.903 ± 0.156 4.044 ± 0.082 1.194 ± 0.076 14078.551 6.923 ± 0.101 3.989 ± 0.090 1.015 ± 0.072 14086.559 7.182 ± 0.097 3.924 ± 0.080 1.062 ± 0.065 14106.531 7.897 ± 0.243 4.107 ± 0.186 – 14111.473 7.469 ± 0.079 4.316 ± 0.078 1.241 ± 0.064 14142.594 7.459 ± 0.097 4.418 ± 0.090 1.120 ± 0.074 14156.270 7.366 ± 0.132 4.429 ± 0.102 1.220 ± 0.077 14331.543 8.416 ± 0.086 5.376 ± 0.095 1.647 ± 0.073 14369.516 7.978 ± 0.124 4.843 ± 0.094 1.556 ± 0.081 14370.539 7.390 ± 0.197 4.736 ± 0.093 1.335 ± 0.074 14377.582 7.570 ± 0.110 4.714 ± 0.107 1.410 ± 0.088 14386.457 7.490 ± 0.098 4.184 ± 0.097 1.294 ± 0.082 14391.551 6.816 ± 0.097 4.384 ± 0.076 1.327 ± 0.061 14392.539 7.115 ± 0.097 4.410 ± 0.081 1.331 ± 0.066 14393.504 7.178 ± 0.093 4.517 ± 0.092 1.396 ± 0.071 14423.559 6.261 ± 0.101 3.715 ± 0.088 1.149 ± 0.084 14438.438 5.934 ± 0.100 3.612 ± 0.075 1.043 ± 0.066 14480.414 7.435 ± 0.082 4.110 ± 0.080 1.166 ± 0.067 14481.398 7.342 ± 0.086 4.108 ± 0.083 1.049 ± 0.065 14482.434 7.498 ± 0.091 4.016 ± 0.086 1.179 ± 0.075 14496.367 7.517 ± 0.114 4.244 ± 0.094 1.209 ± 0.074 14497.418 7.561 ± 0.123 3.955 ± 0.099 1.155 ± 0.082 14499.328 7.615 ± 0.090 4.125 ± 0.088 1.168 ± 0.077 14508.418 7.071 ± 0.106 4.272 ± 0.088 1.258 ± 0.076 14537.340 6.605 ± 0.099 3.742 ± 0.086 1.233 ± 0.082 14554.324 5.749 ± 0.125 3.736 ± 0.099 0.942 ± 0.083 14574.309 6.132 ± 0.269 3.303 ± 0.226 – 14586.309 6.284 ± 0.086 3.550 ± 0.074 1.064 ± 0.069 14587.281 6.184 ± 0.092 3.576 ± 0.080 1.003 ± 0.067 14588.266 6.264 ± 0.098 3.577 ± 0.082 1.027 ± 0.068 14590.309 6.278 ± 0.098 3.543 ± 0.076 0.968 ± 0.060

Table 1 – continued F5170 spectral continuum, the Hβ and Hγ line fluxes.

JD-2,440,000 F 5170 Hβ Hγ

14591.273 6.440 ± 0.108 3.556 ± 0.086 1.020 ± 0.077 14617.344 7.076 ± 0.086 3.632 ± 0.081 0.955 ± 0.062 14620.301 7.053 ± 0.091 3.923 ± 0.090 1.053 ± 0.071 14622.426 7.141 ± 0.087 3.682 ± 0.084 1.048 ± 0.068 14687.547 6.498 ± 0.095 4.099 ± 0.073 1.091 ± 0.057 14779.629 7.584 ± 0.127 4.711 ± 0.106 1.328 ± 0.070 14804.566 8.214 ± 0.093 4.650 ± 0.086 1.305 ± 0.070

Units are 10^{−13} ergs cm^{−2} s^{−1} and 10^{−15} ergs cm^{−2} s^{−1} Å^{−1} for the lines and continuum, respectively.

cess. The Fvar values in Table 4 are the lowest limits of actual Fvar because the observed fluxes were not corrected for starlight contamination.

3 CROSS-CORRELATION BETWEEN THE CONTINUUM AND THE INTEGRAL BALMER LINE FLUX VARIATIONS

As mentioned in the Introduction, estimating the light travel time delay between the continuum and emission line flux variations is of special relevance for the determination of the BLR size, which, in turn, can be used for black hole mass measurements (see Wandel et al. 1999; Peterson et al. 2004). This time delay (or lag) is estimated through the cross-correlation function (CCF). Koratkar& Gaskell (1991) demonstrated that the CCF centroid gives the luminosityweighted radius, in contrast to the CCF peak, which is more influenced by gas at small radii, according to Gaskell & Sparke (1986).

The time delays were computed using the interpolated cross-correlation function (ICCF) (Gaskell & Sparke 1986; White & Peterson 1994; Peterson 2001). We computed both the lag related to the CCF peak (τ_{pk}) and the CCF centroid (τcn). The CCF centroid was adopted to be measured above the correlation level at r ⩾ 0.8rmax. The lag uncertainties were computed using the model-independent Monte Carlo flux randomization/random subset selection (FR/RSS) technique described by Peterson et al. (1998). The number of realizations was as large as 4000. The uncertainties were computed from the distribution function for τ_{pk} and τcn at the 68% confidence, which corresponds to ±1σ errors for the normal distribution.

The spectra for the 1992 season were obtained with the 2^{′′} entrance slit and they were discarded from the CCF analysis in order to exclude the aperture effects. The results of the cross-correlation analysis for the 1993–2008 interval are presented in Table 5. The meaning of symbols ”s” and ”scp” in the first and second columns of Table 5 is the same as in Table 4: ”s” – from spectral observations only and ”scp” – from combined spectral and photometric observations (”c” – CCD, ”p” – photoelectric).

Figure 4 shows the cross-correlation results for the Hβ and Hα line fluxes with the continuum as well as autocorrelation functions of the continuum for the 1993–2008 time interval. Table 5 gives the cross-correlation results. When the continuum light curve is a combination of the spectral

6 V. T. Doroshenko et al.

Table 2. F7030 spectral continuum and Hα fluxes.

JD-2,440,000 F 7030 Hα

10869.359 6.858 ± 0.194 31.959 ± 0.796 10876.453 7.063 ± 0.177 32.400 ± 0.833 10905.332 7.403 ± 0.176 33.322 ± 0.722 11053.559 6.227 ± 0.177 30.750 ± 0.726 11075.582 6.408 ± 0.171 30.532 ± 0.713 11220.219 6.271 ± 0.231 29.815 ± 1.056 11279.324 7.851 ± 0.210 37.009 ± 0.962 11321.301 5.697 ± 0.265 33.947 ± 1.258 11517.488 5.327 ± 0.268 31.821 ± 1.134 11587.355 5.174 ± 0.195 27.152 ± 0.741 11638.250 6.202 ± 0.163 29.285 ± 0.743 11707.344 6.400 ± 0.165 30.001 ± 0.712 11721.324 6.689 ± 0.188 32.688 ± 0.838 11823.543 6.115 ± 0.221 32.067 ± 0.951 11847.531 5.611 ± 0.204 30.121 ± 0.891 11878.512 6.134 ± 0.216 30.642 ± 0.918 11902.461 6.325 ± 0.219 30.126 ± 0.899 12000.254 4.590 ± 0.381 28.123 ± 1.239 12031.402 6.159 ± 0.277 27.928 ± 1.015 12105.324 5.290 ± 0.183 28.077 ± 0.731 12176.520 4.917 ± 0.209 27.194 ± 0.780 12193.508 4.927 ± 0.263 28.147 ± 1.009 12225.438 3.968 ± 0.598 28.053 ± 1.987 12323.457 4.401 ± 0.166 22.116 ± 0.518 12343.551 4.813 ± 0.394 25.054 ± 1.615 12613.594 5.715 ± 0.277 26.821 ± 1.083 12675.477 5.779 ± 0.193 26.451 ± 0.827 13090.277 4.505 ± 0.297 24.783 ± 0.909 13356.465 3.857 ± 0.159 20.999 ± 0.656 13610.559 8.018 ± 0.215 31.853 ± 0.796 13621.555 8.487 ± 0.240 32.350 ± 0.891 13642.594 7.377 ± 0.235 31.616 ± 1.047 13648.551 7.688 ± 0.277 30.374 ± 1.081 13648.563 7.474 ± 0.218 30.213 ± 0.859 13789.316 7.176 ± 0.227 32.545 ± 0.986 13831.234 7.418 ± 0.186 30.618 ± 0.825 13994.586 8.940 ± 0.228 34.663 ± 0.875 14066.457 8.472 ± 0.257 34.872 ± 1.008 14370.563 8.707 ± 0.264 37.536 ± 1.117 14392.563 8.377 ± 0.206 36.161 ± 0.988 14393.527 8.125 ± 0.256 35.540 ± 1.017 14481.387 8.255 ± 0.243 34.970 ± 1.044 14508.445 8.117 ± 0.377 36.963 ± 1.866 14617.324 7.455 ± 0.205 31.689 ± 0.795 14620.316 8.052 ± 0.228 33.558 ± 0.900 14622.367 7.785 ± 0.204 32.227 ± 0.890 14804.543 10.004 ± 0.242 38.158 ± 0.965

Units are 10^{−13} ergs cm^{−2} s^{−1} and 10^{−15} ergs cm^{−2} s^{−1} Å^{−1} for the Hα line and continuum, respectively.

and the photometric data (designated as F 5170scp in Table 5) then the CCF computation has been carried out with the rebinning the F 5170scp light curve to the times of observations of the first time series. This is because the combined continuum light curve has much more data points than the continuum light curves which consist from the spectral data only (designated as F 5170s in Table 5). For the F 5170s light curve, we follow a standard method of the CCF computation with rebinnig both time series.

The variations of the Hα and Hβ fluxes are tightly correlated as well as variations of the continuum fluxes near both

Table 3. Combined F5170 continuum fluxes from spectral and photometric observations.

JD-2,440,000 F 5170 Julian Date F 5170

8630.5781 4.072 ± 0.107 9783.2969 7.666 ± 0.098 8716.4258 5.003 ± 0.143 9814.2656 7.775 ± 0.124 8717.3633 5.083 ± 0.129 9838.3027 7.282 ± 0.356 8927.5117 4.125 ± 0.054 9839.3398 6.827 ± 0.240 8983.4009 4.277 ± 0.050 9867.3389 7.121 ± 0.303 9001.2852 4.483 ± 0.151 9871.3545 6.683 ± 0.252 9031.2314 3.991 ± 0.150 9872.3594 6.775 ± 0.080 9057.2441 4.225 ± 0.146 9980.5746 6.749 ± 0.058 9059.3291 4.483 ± 0.171 10008.5636 7.303 ± 0.052 9062.3330 4.331 ± 0.161 10009.5860 7.380 ± 0.072 9070.2891 4.274 ± 0.068 10010.5900 7.445 ± 0.083 9074.3203 4.378 ± 0.059 10013.5390 7.236 ± 0.251 9088.2656 5.198 ± 0.076 10015.5170 7.458 ± 0.255 9089.2578 5.019 ± 0.079 10024.5360 7.791 ± 0.289 9100.2910 5.021 ± 0.186 10036.5900 7.798 ± 0.119 9101.2930 5.116 ± 0.174 10047.5526 8.101 ± 0.057 9141.3047 6.684 ± 0.119 10064.5120 7.593 ± 0.072 9156.3203 7.048 ± 0.126 10069.4550 6.782 ± 0.231 9250.5977 6.075 ± 0.170 10092.2260 7.053 ± 0.241 9252.5757 6.082 ± 0.093 10094.2990 7.399 ± 0.253 9255.4814 5.841 ± 0.210 10096.3280 6.939 ± 0.234 9272.6016 5.799 ± 0.068 10102.3720 7.282 ± 0.255 9273.4551 5.769 ± 0.211 10133.2640 6.606 ± 0.229 9274.5796 5.568 ± 0.047 10135.3040 7.540 ± 0.276 9275.4990 5.164 ± 0.184 10139.4580 7.376 ± 0.252 9311.5742 5.665 ± 0.077 10156.3134 7.602 ± 0.067 9313.4385 5.567 ± 0.061 10159.3190 7.949 ± 0.275 9329.4219 5.841 ± 0.214 10161.4450 7.790 ± 0.082 9331.4531 6.418 ± 0.068 10201.5550 6.994 ± 0.165 9332.4521 6.027 ± 0.212 10202.4060 7.008 ± 0.092 9341.3809 6.313 ± 0.219 10212.2930 5.893 ± 0.229 9357.3135 6.540 ± 0.233 10213.4450 6.383 ± 0.078 9359.3467 6.090 ± 0.211 10218.3130 5.790 ± 0.225 9362.3525 6.017 ± 0.208 10222.3060 6.101 ± 0.223 9364.3281 6.334 ± 0.067 10225.3320 5.847 ± 0.077 9365.4180 6.448 ± 0.060 10246.3710 5.474 ± 0.060 9395.3750 6.140 ± 0.068 10258.3980 5.091 ± 0.110 9399.3984 6.155 ± 0.088 10304.4220 6.479 ± 0.081 9450.3438 6.618 ± 0.062 10361.5310 6.989 ± 0.068 9452.2461 6.651 ± 0.100 10363.4840 7.053 ± 0.070 9454.2734 6.731 ± 0.077 10364.5410 7.064 ± 0.274 9488.3398 7.461 ± 0.072 10372.4804 7.427 ± 0.040 9520.3281 6.829 ± 0.076 10392.5060 7.411 ± 0.271 9536.3867 6.575 ± 0.064 10395.4687 7.013 ± 0.049 9548.5000 6.048 ± 0.099 10396.4610 7.103 ± 0.063 9554.5234 5.900 ± 0.111 10397.4610 7.274 ± 0.063 9555.5117 5.813 ± 0.124 10399.4490 7.179 ± 0.078 9566.4570 5.304 ± 0.068 10401.4600 7.018 ± 0.246 9578.3984 5.070 ± 0.058 10403.4010 7.599 ± 0.267 9599.3672 4.653 ± 0.134 10404.4920 7.635 ± 0.258 9622.2734 5.361 ± 0.094 10406.5080 7.446 ± 0.240 9639.5547 5.878 ± 0.096 10408.5900 7.202 ± 0.229 9653.5635 6.298 ± 0.074 10430.3770 6.573 ± 0.224 9665.5331 5.784 ± 0.069 10434.3200 6.386 ± 0.055 9685.3984 6.646 ± 0.147 10435.3240 6.586 ± 0.072 9691.5078 6.915 ± 0.086 10436.4100 6.371 ± 0.052 9713.4539 7.374 ± 0.052 10461.5560 5.841 ± 0.195 9716.5488 7.064 ± 0.252 10482.5040 6.621 ± 0.088 9723.4297 7.226 ± 0.081 10483.4790 6.683 ± 0.220 9744.3984 8.089 ± 0.078 10484.4480 6.628 ± 0.209 9753.3086 8.467 ± 0.074 10487.3660 6.410 ± 0.213 9754.3789 8.249 ± 0.183 10491.4380 6.573 ± 0.222

Black Hole Mass in Mrk 6 7

Table 3 – continued Combined F5170 continuum fluxes from spectral and photometric observations.

JD-2,440,000 F 5170 Julian Date F 5170

9771.3086 7.988 ± 0.071 10495.3670 6.383 ± 0.057 10509.3810 6.054 ± 0.062 11085.5700 6.117 ± 0.066 10510.4262 5.990 ± 0.044 11088.4720 5.330 ± 0.184 10511.3540 5.608 ± 0.196 11100.5120 6.344 ± 0.076 10518.4320 5.408 ± 0.176 11105.5480 6.584 ± 0.214 10519.4260 5.638 ± 0.190 11110.5780 5.790 ± 0.195 10521.3830 5.709 ± 0.192 11111.5760 5.924 ± 0.207 10522.3851 5.517 ± 0.067 11141.4334 5.127 ± 0.081 10541.3549 5.524 ± 0.046 11163.4850 5.729 ± 0.185 10543.2960 5.059 ± 0.188 11164.3130 6.207 ± 0.220 10566.3030 6.464 ± 0.230 11176.5790 5.478 ± 0.192 10569.3380 5.517 ± 0.196 11192.3790 5.810 ± 0.201 10574.3634 5.080 ± 0.038 11197.2630 5.934 ± 0.211 10575.3160 4.840 ± 0.054 11199.3480 5.021 ± 0.174 10576.3520 4.868 ± 0.058 11218.2810 5.525 ± 0.117 10580.3820 5.252 ± 0.210 11261.4920 7.018 ± 0.250 10597.3852 5.460 ± 0.083 11274.3120 6.951 ± 0.229 10601.3550 5.540 ± 0.064 11278.3950 6.743 ± 0.074 10611.3440 6.296 ± 0.099 11279.2870 6.650 ± 0.237 10628.3590 6.778 ± 0.081 11281.3662 6.943 ± 0.081 10642.3320 6.824 ± 0.068 11290.4020 5.878 ± 0.187 10654.3320 6.808 ± 0.153 11306.3890 5.709 ± 0.203 10655.3280 6.764 ± 0.081 11310.2890 5.216 ± 0.067 10687.5700 6.033 ± 0.116 11319.3130 4.817 ± 0.063 10697.4208 5.833 ± 0.048 11322.3050 5.134 ± 0.148 10699.5270 5.661 ± 0.057 11346.3850 5.164 ± 0.203 10705.5590 5.587 ± 0.188 11349.3240 4.884 ± 0.084 10714.5080 5.504 ± 0.063 11400.5350 4.851 ± 0.247 10715.5200 5.526 ± 0.061 11407.5290 5.021 ± 0.167 10728.5390 5.333 ± 0.052 11409.5370 4.841 ± 0.191 10729.5080 5.399 ± 0.056 11454.5560 5.658 ± 0.207 10747.5430 5.962 ± 0.076 11467.4890 5.310 ± 0.181 10748.4650 5.950 ± 0.057 11485.5040 5.096 ± 0.072 10755.5340 6.196 ± 0.211 11488.6040 5.136 ± 0.193 10758.5249 5.924 ± 0.052 11493.3450 5.438 ± 0.202 10759.4380 5.777 ± 0.076 11497.4340 5.160 ± 0.086 10760.5280 5.924 ± 0.195 11516.5510 5.103 ± 0.073 10761.5130 6.185 ± 0.206 11522.5520 4.610 ± 0.162 10762.5670 6.196 ± 0.209 11524.5720 5.184 ± 0.231 10777.4300 5.776 ± 0.067 11525.4560 5.126 ± 0.190 10801.2660 5.955 ± 0.203 11557.3624 4.581 ± 0.056 10817.3570 5.389 ± 0.177 11577.4060 4.456 ± 0.066 10863.3710 6.562 ± 0.221 11581.3890 4.547 ± 0.153 10866.3790 6.377 ± 0.234 11586.4480 4.601 ± 0.157 10867.4230 6.291 ± 0.210 11587.3295 4.542 ± 0.053 10868.4180 6.453 ± 0.212 11588.5210 4.907 ± 0.163 10869.4520 5.996 ± 0.047 11598.2560 4.721 ± 0.180 10873.4040 6.410 ± 0.208 11603.2890 4.879 ± 0.192 10874.2920 6.324 ± 0.228 11605.4510 5.145 ± 0.191 10875.4490 6.279 ± 0.209 11606.3830 4.821 ± 0.112 10876.3961 6.207 ± 0.063 11608.3236 4.493 ± 0.056 10905.3950 6.451 ± 0.057 11612.3560 5.097 ± 0.181 10906.2730 6.352 ± 0.088 11615.3400 5.173 ± 0.114 10924.4482 5.708 ± 0.074 11628.3200 5.729 ± 0.209 10957.3660 5.136 ± 0.200 11636.2700 5.252 ± 0.076 10966.3790 5.008 ± 0.058 11661.2870 5.310 ± 0.194 10982.3950 5.570 ± 0.101 11707.4020 5.783 ± 0.095 10994.3922 5.671 ± 0.053 11720.3360 5.875 ± 0.069 11014.5160 5.302 ± 0.091 11780.5550 5.757 ± 0.102 11044.3860 5.408 ± 0.220 11782.5550 5.868 ± 0.080 11050.5250 5.498 ± 0.181 11788.5360 5.638 ± 0.243 11052.5630 5.519 ± 0.081 11791.5310 5.385 ± 0.093

Table 3 – continued Combined F5170 continuum fluxes from spectral and photometric observations.

JD-2,440,000 F 5170 Julian Date F 5170

11074.5740 5.665 ± 0.064 11810.5310 5.463 ± 0.075 11076.4995 5.650 ± 0.077 11817.5320 5.986 ± 0.243 11818.5550 5.408 ± 0.185 12349.3890 3.483 ± 0.133 11821.5820 5.010 ± 0.092 12366.2620 3.890 ± 0.024 11823.4960 5.049 ± 0.072 12367.2780 3.984 ± 0.026 11838.5080 5.234 ± 0.183 12368.3450 4.077 ± 0.057 11840.5390 5.027 ± 0.103 12369.2769 4.188 ± 0.022 11842.4730 5.388 ± 0.206 12381.2620 4.039 ± 0.125 11843.5660 5.184 ± 0.439 12385.3530 4.388 ± 0.033 11844.4960 4.679 ± 0.072 12386.2840 4.481 ± 0.038 11847.5150 4.600 ± 0.062 12387.2960 4.401 ± 0.034 11853.5681 4.767 ± 0.049 12388.3290 4.504 ± 0.050 11866.4100 5.478 ± 0.233 12399.3050 4.898 ± 0.169 11867.3210 5.155 ± 0.197 12403.3180 5.097 ± 0.190 11868.3710 5.349 ± 0.190 12404.2690 5.073 ± 0.029 11869.4960 5.184 ± 0.073 12405.3055 5.015 ± 0.030 11878.4490 5.012 ± 0.080 12406.3010 5.193 ± 0.227 11879.2630 5.222 ± 0.212 12407.2730 4.971 ± 0.034 11882.4800 4.656 ± 0.170 12408.2942 5.104 ± 0.025 11901.3160 5.436 ± 0.106 12409.3480 5.078 ± 0.216 11902.2690 5.688 ± 0.205 12410.2870 5.132 ± 0.028 11912.5120 5.116 ± 0.190 12411.2860 5.119 ± 0.029 11926.2770 4.424 ± 0.056 12417.2820 5.289 ± 0.052 11932.4920 4.795 ± 0.184 12419.3020 5.272 ± 0.049 11959.2270 4.689 ± 0.129 12421.2880 5.175 ± 0.058 11999.2700 4.517 ± 0.112 12440.2860 5.165 ± 0.050 12030.4220 5.191 ± 0.100 12441.3590 5.067 ± 0.078 12050.4650 4.689 ± 0.087 12442.2850 5.123 ± 0.044 12104.3160 4.394 ± 0.069 12459.2830 5.198 ± 0.064 12139.5420 4.138 ± 0.196 12476.2920 5.265 ± 0.063 12144.5390 4.620 ± 0.200 12484.3370 4.793 ± 0.064 12147.5200 4.060 ± 0.155 12498.4950 4.379 ± 0.024 12166.5140 4.629 ± 0.167 12530.5830 4.424 ± 0.031 12174.5390 4.327 ± 0.069 12536.5580 4.640 ± 0.025 12175.5310 4.153 ± 0.084 12539.5520 4.732 ± 0.040 12192.5510 4.046 ± 0.095 12541.5710 4.653 ± 0.041 12199.5620 4.094 ± 0.151 12557.5940 4.579 ± 0.027 12201.5449 3.888 ± 0.054 12566.4570 4.422 ± 0.036 12210.5970 4.129 ± 0.149 12569.5400 4.648 ± 0.043 12223.5055 4.090 ± 0.060 12593.6361 4.954 ± 0.035 12225.3400 4.340 ± 0.161 12595.3070 4.844 ± 0.035 12231.5060 4.060 ± 0.151 12596.5600 4.890 ± 0.043 12263.4680 4.094 ± 0.024 12597.5780 4.956 ± 0.044 12265.5230 4.182 ± 0.140 12605.5350 5.416 ± 0.051 12280.5470 3.783 ± 0.020 12608.5690 5.428 ± 0.034 12281.4510 3.725 ± 0.018 12609.5610 5.467 ± 0.030 12283.4430 3.801 ± 0.020 12610.4815 5.324 ± 0.028 12298.4070 3.623 ± 0.022 12612.5340 5.550 ± 0.030 12301.3840 3.625 ± 0.028 12613.4293 5.497 ± 0.030 12307.2820 3.427 ± 0.129 12614.5590 5.548 ± 0.033 12308.3500 3.628 ± 0.019 12618.3620 5.532 ± 0.026 12309.4384 3.599 ± 0.019 12619.5547 5.452 ± 0.026 12310.4000 3.307 ± 0.128 12620.4070 5.375 ± 0.035 12313.4260 3.307 ± 0.132 12621.4710 5.477 ± 0.034 12314.3730 3.823 ± 0.030 12625.4390 5.301 ± 0.036 12316.4110 3.906 ± 0.020 12634.2880 4.730 ± 0.164 12321.4275 4.018 ± 0.023 12635.4457 5.088 ± 0.155 12322.4080 4.144 ± 0.023 12636.3986 5.035 ± 0.042 12323.3560 4.108 ± 0.021 12665.3620 4.728 ± 0.026 12324.3990 4.152 ± 0.126 12672.3350 4.974 ± 0.038 12336.2490 3.507 ± 0.110 12674.4100 5.041 ± 0.031 12342.4700 3.402 ± 0.144 12675.3846 5.002 ± 0.028

8 V. T. Doroshenko et al.

Table 3 – continued Combined F5170 continuum fluxes from spectral and photometric observations.

JD-2,440,000 F 5170 Julian Date F 5170

12343.4263 3.559 ± 0.046 12683.3540 4.635 ± 0.037 12346.3890 3.499 ± 0.132 12684.3840 4.703 ± 0.034 12348.2790 3.315 ± 0.141 12685.3890 4.632 ± 0.051 12689.3540 4.830 ± 0.041 12998.4690 4.207 ± 0.024 12694.3330 4.772 ± 0.034 13003.4349 4.187 ± 0.022 12696.3900 5.087 ± 0.195 13006.4560 4.084 ± 0.056 12697.3620 4.836 ± 0.025 13007.4330 4.046 ± 0.034 12698.3500 4.913 ± 0.027 13015.4930 3.971 ± 0.057 12700.3786 4.836 ± 0.027 13022.4180 4.391 ± 0.024 12701.3560 4.781 ± 0.027 13023.3250 4.367 ± 0.143 12703.2680 4.711 ± 0.175 13058.3160 4.776 ± 0.026 12710.2760 4.595 ± 0.028 13071.4320 4.767 ± 0.072 12716.2540 4.167 ± 0.033 13073.3260 4.521 ± 0.033 12722.3690 4.069 ± 0.145 13077.3130 4.367 ± 0.136 12723.4030 3.889 ± 0.142 13083.3410 4.438 ± 0.030 12724.3289 4.009 ± 0.024 13084.3190 4.500 ± 0.029 12726.2940 3.771 ± 0.138 13084.3190 4.500 ± 0.029 12727.3100 4.033 ± 0.028 13085.3510 4.558 ± 0.028 12728.3020 4.123 ± 0.024 13087.2780 4.425 ± 0.028 12729.3010 4.177 ± 0.024 13089.3240 4.197 ± 0.062 12730.2840 4.232 ± 0.029 13097.2904 4.606 ± 0.041 12739.2820 4.235 ± 0.028 13098.2500 4.636 ± 0.038 12740.3020 4.185 ± 0.031 13105.3080 4.556 ± 0.152 12742.3080 4.205 ± 0.035 13111.3030 4.978 ± 0.027 12744.3070 4.221 ± 0.030 13112.3115 4.799 ± 0.025 12745.2760 4.272 ± 0.037 13113.3120 4.864 ± 0.028 12751.2799 4.242 ± 0.024 13114.2551 5.012 ± 0.030 12752.2510 4.309 ± 0.024 13115.2890 5.108 ± 0.029 12754.2770 4.383 ± 0.024 13117.3010 4.814 ± 0.164 12756.2860 4.324 ± 0.024 13130.2730 5.063 ± 0.044 12757.2770 4.296 ± 0.024 13133.2930 5.075 ± 0.026 12759.2830 4.647 ± 0.165 13135.2730 5.004 ± 0.029 12766.2680 4.454 ± 0.025 13148.2890 4.770 ± 0.030 12767.2590 4.544 ± 0.029 13149.2750 4.727 ± 0.045 12770.2590 4.320 ± 0.038 13153.2910 4.802 ± 0.032 12771.2560 4.272 ± 0.051 13154.3280 4.884 ± 0.052 12774.2750 4.356 ± 0.035 13277.5570 5.045 ± 0.079 12775.2710 4.353 ± 0.043 13291.5610 4.765 ± 0.029 12778.2980 4.492 ± 0.185 13292.5770 4.817 ± 0.029 12790.3080 4.933 ± 0.028 13296.6160 4.355 ± 0.027 12791.2820 4.859 ± 0.040 13300.6100 4.245 ± 0.029 12841.5450 4.824 ± 0.104 13302.6060 4.161 ± 0.029 12866.5290 5.115 ± 0.034 13305.6230 4.073 ± 0.027 12883.5410 5.011 ± 0.171 13307.6120 4.107 ± 0.053 12889.5360 5.408 ± 0.169 13308.6250 4.040 ± 0.046 12890.5250 5.376 ± 0.032 13309.6280 3.986 ± 0.039 12903.5440 5.300 ± 0.186 13313.6020 4.011 ± 0.027 12906.5980 5.109 ± 0.031 13314.5960 4.109 ± 0.027 12907.5800 4.926 ± 0.159 13315.6030 4.046 ± 0.024 12912.5813 5.089 ± 0.030 13317.5910 3.993 ± 0.027 12913.5490 5.132 ± 0.034 13318.6095 3.912 ± 0.028 12914.5768 5.108 ± 0.028 13319.4960 3.639 ± 0.065 12915.5268 5.260 ± 0.049 13320.4660 3.581 ± 0.116 12945.6380 4.830 ± 0.047 13323.5880 3.991 ± 0.133 12947.5950 4.664 ± 0.032 13331.5011 3.818 ± 0.021 12965.5343 4.463 ± 0.022 13355.4852 3.397 ± 0.019 12966.5492 4.309 ± 0.027 13356.4777 3.397 ± 0.022 12967.5156 4.435 ± 0.026 13357.4334 3.360 ± 0.018 12968.5385 4.372 ± 0.024 13358.4690 3.454 ± 0.021 12973.4510 4.025 ± 0.132 13365.5680 3.342 ± 0.037 12974.5110 3.982 ± 0.131 13379.5508 3.316 ± 0.019 12983.6310 4.241 ± 0.045 13383.4821 3.446 ± 0.019

Table 3 – continued Combined F5170 continuum fluxes from spectral and photometric observations.

JD-2,440,000 F 5170 Julian Date F 5170

12984.5580 4.277 ± 0.034 13384.4410 3.389 ± 0.020 12985.4810 4.329 ± 0.087 13410.4190 3.370 ± 0.113 12988.5170 4.372 ± 0.029 13411.5060 3.259 ± 0.106 12996.5188 4.248 ± 0.024 13412.3370 2.904 ± 0.097 12997.4890 4.193 ± 0.025 13419.3710 3.446 ± 0.047 13423.3570 3.454 ± 0.033 13822.3430 6.565 ± 0.043 13424.4630 3.439 ± 0.068 13823.3110 6.558 ± 0.044 13425.3360 3.493 ± 0.041 13830.2380 6.715 ± 0.113 13434.3090 3.703 ± 0.022 13837.3880 6.661 ± 0.051 13436.3070 3.791 ± 0.024 13839.3400 6.759 ± 0.068 13437.2730 3.483 ± 0.114 13844.3300 6.879 ± 0.040 13441.3348 3.908 ± 0.021 13845.4410 6.959 ± 0.047 13445.2997 4.160 ± 0.024 13849.2870 7.053 ± 0.251 13446.3470 4.388 ± 0.042 13850.2917 7.117 ± 0.041 13449.3550 4.369 ± 0.034 13854.2850 7.053 ± 0.220 13459.3238 4.875 ± 0.026 13875.3320 7.178 ± 0.086 13460.2620 4.978 ± 0.028 13880.3050 6.746 ± 0.036 13461.2693 5.067 ± 0.027 13881.2850 6.795 ± 0.041 13462.3190 5.040 ± 0.032 13953.5550 6.732 ± 0.106 13464.2240 5.285 ± 0.037 13959.5530 6.737 ± 0.080 13465.3125 5.363 ± 0.031 13967.5620 6.846 ± 0.056 13471.2810 5.882 ± 0.206 13973.5680 6.731 ± 0.050 13476.3240 5.693 ± 0.037 13986.5780 7.163 ± 0.090 13478.2290 5.844 ± 0.111 13987.4830 7.138 ± 0.066 13487.2960 5.574 ± 0.029 13989.5540 7.280 ± 0.091 13493.2990 5.485 ± 0.029 13991.5330 7.168 ± 0.069 13495.2680 5.497 ± 0.034 13994.5660 7.272 ± 0.080 13508.3130 5.755 ± 0.037 13995.5930 7.363 ± 0.054 13509.2980 5.987 ± 0.045 14010.5960 7.574 ± 0.066 13611.5630 6.791 ± 0.081 14013.6130 7.494 ± 0.089 13612.5531 6.801 ± 0.083 14022.5790 7.319 ± 0.058 13621.5230 6.877 ± 0.082 14023.4520 7.557 ± 0.061 13641.5660 6.279 ± 0.096 14038.5550 7.741 ± 0.089 13644.5290 5.884 ± 0.039 14044.6030 8.011 ± 0.123 13645.6130 5.900 ± 0.076 14048.5820 7.691 ± 0.097 13647.5700 6.158 ± 0.095 14059.5450 7.104 ± 0.047 13648.6094 5.937 ± 0.048 14060.6550 6.988 ± 0.147 13649.5913 6.174 ± 0.075 14062.5450 7.171 ± 0.054 13650.6170 5.939 ± 0.054 14064.5904 7.159 ± 0.049 13651.5770 5.914 ± 0.040 14065.4730 7.052 ± 0.036 13653.6120 5.885 ± 0.031 14067.5428 6.865 ± 0.045 13654.5950 5.972 ± 0.038 14069.6400 6.920 ± 0.056 13670.5550 6.284 ± 0.083 14076.4610 6.903 ± 0.156 13676.5860 6.309 ± 0.079 14078.5510 6.923 ± 0.101 13680.5980 5.868 ± 0.033 14086.5590 7.182 ± 0.097 13683.5360 5.688 ± 0.189 14091.5530 7.180 ± 0.044 13698.4690 6.366 ± 0.103 14106.5310 7.897 ± 0.243 13702.4780 5.872 ± 0.203 14111.5780 7.450 ± 0.050 13708.5590 6.684 ± 0.036 14116.4500 7.638 ± 0.059 13724.5730 7.009 ± 0.049 14117.5520 7.552 ± 0.331 13728.3990 6.749 ± 0.217 14118.4140 7.587 ± 0.055 13733.5160 6.918 ± 0.039 14119.4440 7.704 ± 0.051 13738.4460 6.940 ± 0.046 14121.5630 7.700 ± 0.047 13739.5320 6.813 ± 0.047 14123.4870 7.720 ± 0.064 13744.5540 6.880 ± 0.047 14142.5940 7.459 ± 0.097 13747.4950 6.735 ± 0.078 14145.3596 7.674 ± 0.049 13749.4240 6.698 ± 0.070 14146.4190 7.550 ± 0.044 13760.3710 6.082 ± 0.030 14149.4380 7.735 ± 0.041 13761.4160 6.143 ± 0.042 14150.4260 7.695 ± 0.038 13763.3990 5.901 ± 0.035 14156.2700 7.366 ± 0.132 13774.4530 5.677 ± 0.189 14167.3450 7.289 ± 0.050 13787.3870 6.090 ± 0.203 14169.2930 7.252 ± 0.048

Black Hole Mass in Mrk 6 9

Table 3 – continued Combined F5170 continuum fluxes from spectral and photometric observations.

JD-2,440,000 F 5170 Julian Date F 5170

13788.3440 5.997 ± 0.091 14171.3070 7.250 ± 0.050 13790.2820 6.259 ± 0.199 14174.4000 7.481 ± 0.243 13799.2870 6.168 ± 0.046 14180.3510 7.516 ± 0.260 13807.3650 6.250 ± 0.057 14181.2360 7.412 ± 0.042 13816.4150 6.349 ± 0.041 14191.2710 7.835 ± 0.083 13820.3430 6.248 ± 0.208 14200.3340 8.249 ± 0.058 14201.2850 7.755 ± 0.269 14523.3480 6.185 ± 0.197 14204.2350 8.256 ± 0.058 14530.3709 6.735 ± 0.064 14206.3000 8.379 ± 0.073 14532.3500 6.735 ± 0.044 14213.2460 7.978 ± 0.049 14534.3240 6.662 ± 0.036 14220.2400 8.159 ± 0.108 14535.3485 6.570 ± 0.031 14234.2640 8.173 ± 0.060 14536.3470 6.542 ± 0.038 14281.2840 8.751 ± 0.203 14537.3175 6.452 ± 0.051 14283.2890 8.724 ± 0.117 14538.3130 6.436 ± 0.062 14331.5430 8.416 ± 0.086 14542.2750 6.073 ± 0.056 14337.5760 8.331 ± 0.118 14554.3231 6.021 ± 0.030 14338.5040 8.265 ± 0.051 14555.2970 5.994 ± 0.093 14369.5160 7.978 ± 0.124 14565.4980 5.939 ± 0.037 14370.5390 7.390 ± 0.197 14567.2910 5.906 ± 0.034 14371.4990 7.464 ± 0.073 14568.2830 6.029 ± 0.043 14372.4860 7.718 ± 0.071 14574.2652 6.262 ± 0.052 14376.5510 7.373 ± 0.061 14582.4170 6.398 ± 0.035 14377.5820 7.570 ± 0.110 14585.2780 6.093 ± 0.046 14386.4570 7.490 ± 0.098 14586.3090 6.284 ± 0.086 14391.6032 7.187 ± 0.051 14587.2927 6.252 ± 0.034 14392.5390 7.115 ± 0.097 14588.2802 6.184 ± 0.054 14393.5960 7.037 ± 0.045 14590.3090 6.278 ± 0.098 14423.5722 6.184 ± 0.037 14591.2730 6.440 ± 0.108 14425.6040 6.198 ± 0.032 14596.3030 6.331 ± 0.101 14426.5370 6.223 ± 0.047 14600.2710 6.832 ± 0.055 14428.4230 6.298 ± 0.058 14601.3560 6.695 ± 0.093 14434.4860 6.146 ± 0.044 14602.3840 6.727 ± 0.057 14438.4380 5.934 ± 0.100 14603.3040 6.667 ± 0.051 14439.6060 6.055 ± 0.034 14604.3070 6.752 ± 0.056 14443.5395 6.118 ± 0.031 14617.2919 6.978 ± 0.059 14444.5270 6.180 ± 0.033 14618.2730 6.876 ± 0.087 14465.4540 7.011 ± 0.042 14620.3010 7.053 ± 0.091 14467.5530 7.210 ± 0.043 14622.4260 7.140 ± 0.087 14472.4660 7.411 ± 0.041 14628.3120 6.876 ± 0.046 14475.4050 6.727 ± 0.227 14632.3170 6.960 ± 0.075 14476.4683 7.358 ± 0.048 14643.3460 7.117 ± 0.044 14477.4660 7.463 ± 0.058 14647.3060 7.129 ± 0.041 14478.4300 7.452 ± 0.053 14687.5470 6.498 ± 0.095 14479.4230 7.456 ± 0.053 14713.5470 7.087 ± 0.267 14480.4251 7.368 ± 0.049 14718.5400 7.288 ± 0.051 14481.4803 7.412 ± 0.054 14720.5630 7.213 ± 0.227 14482.4074 7.451 ± 0.053 14738.5060 7.030 ± 0.237 14483.4110 7.452 ± 0.069 14740.4520 7.053 ± 0.241 14484.3690 7.183 ± 0.069 14742.5900 7.451 ± 0.051 14488.4530 7.111 ± 0.120 14769.5830 8.158 ± 0.265 14490.4630 7.314 ± 0.062 14778.5960 8.054 ± 0.050 14496.4231 7.715 ± 0.044 14779.6064 8.005 ± 0.041 14497.4230 7.654 ± 0.054 14780.5790 8.052 ± 0.042 14498.4680 7.550 ± 0.051 14781.5400 7.969 ± 0.048 14499.4361 7.641 ± 0.045 14784.3780 8.013 ± 0.128 14500.4060 7.739 ± 0.050 14786.4900 8.206 ± 0.084 14502.4057 7.653 ± 0.052 14796.4990 8.174 ± 0.050 14503.4437 7.605 ± 0.045 14799.6310 8.263 ± 0.061 14508.4223 7.310 ± 0.034 14801.3500 8.467 ± 0.064 14512.5400 6.981 ± 0.131 14802.5980 8.346 ± 0.052 14522.2720 6.496 ± 0.211 14804.5660 8.214 ± 0.093

Continuum fluxes are in units 10^{−15} ergs cm^{−2} s^{−1} Å^{−1}

Table 4. Light curve statistics.

Time N dt-med Mean stdb Fvar Rmax seriesa (days) Fluxb

(1) (2) (3) (4) (5) (6) (7)

1992–2008, JD2448630–2454804 F5170s 235 14 6.093 1.101 0.18±0.03 2.65±0.06 F5170scp 742 3 5.780 1.277 0.22±0.05 3.16±0.08 Hβ 235 14 4.065 0.658 0.16±0.03 2.70±0.09

F7030s 102 29 6.897 1.261 0.18±0.04 2.43±0.17 Hα 102 29 32.06 3.77 0.11±0.02 1.83±0.09

a The letters in the first column indicate the origin of the continuum fluxes: ”s” – from the spectral observations only and ”scp” – from combined spectral and photometric observations (”c” – CCD photometry, ”p” – photoelectric photometry). b Mean fluxes and standard deviations (std) are in units of 10^{−13} erg cm^{−2} s^{−1} and 10^{−15} erg cm^{−2} s^{−1} Å^{−1} for the lines and the continuum, respectively.

Figure 4. CCFs of Mrk 6 between the Hβ and continuum F5170 fluxes (left panel) as well as between the Hα and continuum F7090 in 1993–2008 (thick lines). ACFs are shown by dashed lines.

lines (the correlation coefficients are equal to 0.93 and 0.97, respectively). The positive lag values for the ‘Hα–Hβ’ and ‘F7030–F5170’ light curves mean that the region of effective continuum emission at λ5170 is probably smaller than that at λ7030 and the region of effective Hβ emission is probably smaller than that Hα. The probability that the delay for the ‘F7030–F5170’ and ‘Hα–Hβ’ is less than zero equals to 0.023 and 0.036, respectively.

Table 5. Cross-correlation results for 1993–2008.

First set Second set r_{max} τ_{cn} τ_{pk}

Hβ F5170s 0.84 21.5^{+3.9}_{−2.1} 21.0^{+1.6}_{−4.9}

Hβ F5170scp 0.83 21.9^{+2.6}_{−2.7} 21.0^{+1.2}_{−4.0}

Hα F7030s 0.88 31.6^{+10.9}_{−8.4} 18.0^{+8.3}_{−6.4}

Hα F5170scp 0.85 26.8^{+10.6}_{−4.8} 22.0^{+6.9}_{−6.9}

Hα Hβ 0.93 8.5^{+8.6}_{−4.2} 2.5^{+0.4}_{−1.6}

F7030s F5170s 0.97 7.2^{+3.7}_{−4.4} 5.5^{+2.5}_{−1.5}

F7030s F5170scp 0.96 8.4^{+2.1}_{−3.6} 3.2^{+4.4}_{−1.8}

Hγ F5170sc 0.53 33.1^{+9.2}_{−11.6} 27.1^{+17.1}_{−5.9}

Hγ Hβ 0.82 8.9^{+8.1}_{−9.1} −0.6^{+18.3}_{−2.3}

Meaning of symbols ”s” and ”scp” the same as in Table4.

10 V. T. Doroshenko et al.

Table 6. Time intervals for time series analysis in the Hβ region.

Time JD2440000+ N Δt_{med} Series Hβ cont^a Hβ cont

1 09250–09872 38 51 sp 14.0 8.9 2 09980–10777 54 90 sp 11.9 3.0 3 10869–11516 27 59 sp 16.0 6.1 4 11557–13356 47 266 scp 19.1 2.0 5 13611–14804 58 242 scp 10.8 2.1

a Meaning of symbols ”sp” and ”scp” is the same as in Table4.

The time interval 1993–2008, that has been used for cross-correlation analysis, is very long. We have divided it into five subinterval in order to check whether the lag values for individual sub-intervals are the same as for the entire 1993–2008 period, whether they are changed in time, and whether they are correlated with the fluxes and with line widths. In particular, the effective region of the broad-line emission can depend on the incident continuum flux, so the lag can depend on the continuum flux. Under a virialized motion of the line-emitting gas the expected relation between the lag τ and the line width V is as follows: V ∝ τ^{−1/2}. To this end, we used only the Hβ spectra because more reliable lag estimate for this line, and we carried out the crosscorrelation analysis separately for each of the five time intervals listed in the Table 6. The first and second intervals were taken the same as in the paper by Sergeev et al. (1999).

The cross-correlation results for the five time subintervals are given in Table 7. For the continuum light curve in Table 7 that consists of the spectral data only (i.e., when the number of data points in both the Hβ and continuum light curves is the same) we have used the standard method of the CCF computation with the rebinning both time series. When the photometric data are added to the continuum light curve, only the continuum light curve was rebinned to the times of observation of the Hβ light curve. As for the entire period, the lag uncertainties for the individual subintervals were computed by using the FR/RSS method as given by Peterson et al. (1998). The uncertainties for each subinterval were computed using 4000 FR/RSS realizations, and the probability distributions for both τcn and τ_{pk} were calculated. Each of these distributions was found to be very different from the normal distribution. To obtain the unweighted mean lag and its uncertainties we have sequentially (one after another) performed the convolution of the five individual distributions and then we have scaled the τ -axis by dividing it by a number of subintervals (i.e., by five). After the convolution operation, the final probability distribution was found to be almost normal with the expectation and standard deviation as given in Table 7 for the mean lag.

Since there are large gaps in our time series, we decided to investigate in more detail their effect on the lag uncertainties for Mrk 6. To make sure that the uncertainties in our lag estimates are realistic, we decided to verify the effect of the sampling of our time series to the lag determination and to compare results with those obtained by random subset selection (RSS) method. We have generated random time series with the same autocorrelation function

Table 7. Cross-correlation results for the Hβ line for the five subintervals.

Subset N points τ_{cn} τ_{pk} r_{max} Number Hβ F5170

1 38 38 22.7^{+7.4}_{−3.0} 20.5^{+4.7}_{−2.8} 0.939

2 54 54 20.8^{+3.0}_{−2.6} 18.1^{+3.6}_{−1.0} 0.942

3 27 27 19.3^{+4.0}_{−6.0} 18.2^{+7.7}_{−6.1} 0.761

4 47 199^a 26.2^{+12.3}_{−6.8} 14.2^{+14.6}_{−1.4} 0.898

5 58 230^a 20.2^{+5.0}_{−3.9} 26.8^{+0.3}_{−13.8} 0.794

Mean value: 21.4±2.0 19.3±1.9

1 38 51^b 21.2^{+4.0}_{−3.2} 21.0^{+4.0}_{−3.4} 0.923

2 54 90^b 20.7^{+3.0}_{−2.4} 22.0^{+1.3}_{−4.7} 0.939

3 27 59^b 20.5^{+5.6}_{−7.0} 28.5^{+1.4}_{−21.9} 0.683

4 47 266^c 23.9^{+17.0}_{−7.3} 9.5^{+15.6}_{−1.2} 0.881

5 58 242^c 20.4^{+4.6}_{−4.1} 21.8^{+5.1}_{−8.7} 0.803

Mean value 21.1±1.9 20.5±2.2

a Continuum light curve was combined from the spectral data and from the CCD photometry.

b Continuum light curve was combined from the spectral data and from the photoelectric photometry.

c Continuum light curve was combined from the spectral data and from both the CCD and photoelectric photometry.

as observed ACF. Stationary random process (or time series) with a given ACF can be generated from an array of independent random values ξ1, ξ2, ξ3, . . . , ξn. To do this, it is necessary to find a matrix Uij , such that the multiplication of the matrix U to the vector ξ gives a vector of dependent random values x1, x2, x3, . . . , xn, with a given correla- tion matrix ρij = ACF (tj − ti), where t1, t2, t3, . . . , tn are times of observations. The matrix U is related to the correlation matrix ρ as follows:

ρ = U U^T, (1)

where T denotes a transposition operation. We used our own algorithm to compute the matrix U from ACF.

First we have generated 1000 realizations of the continuum light curve with a time resolution of 1 day over a period of 6452 days, which is longer than the real observed time interval (6175 days).

To simulate the Hβ light curve from the continuum light curve we have experimented with the three kinds of transfer functions: (1) delta-function δ(τ −20), (2) Π-shaped function which is a constant for 0 < τ < 40, and (3) triangular function which is linearly decreased down to a zero value from τ = 0 to τ = 68.3. Here the lag τ are in units of days. After the convolution with the simulated continuum light curves, all the transfer functions give the Hβ light curve with a lag of about 20 days. Next the simulated continuum and line light curves were rebinned to real moments of observations and the cross-correlation functions were computed for each realization. The lag peak and centroid were measured. The largest uncertainties were obtained when we used the triangular transfer function. These uncertainties are only due

Black Hole Mass in Mrk 6 11

to the sampling of the observation data. Table 8 gives a comparison of both methods for uncertainty estimates (i.e., the random time series versus RSS method) for the triangular transfer function. The columns designated as τ_{pk} and τcn are a lag with ±1σ uncertainties computed from the random time series, while other two columns designated as RSS give ±1σ uncertainties computed from RSS method for τ_{pk} and τcn, respectively. The last column of the table is the mean CCF peak value obtained from the method of the random time series. As can be seen from this table, the RSS method gives comparable or larger (up to two times) uncertainties than the method of the random time series does. The random time series method seems to be more direct way to estimate lag uncertainties and since the lag uncertainties were computed in this paper by the RSS method, they seem to be realistic or slightly overestimated.

There is a contradiction between our lag estimate and the preliminary results on Mrk 6 published in a conference proceeding by Grier et al. (NASA ADS tag 2011nlsg.confE..52G). This new campaign had a nightly sampling rate and it spanned 125 nights beginning 2010 August 31 and ending on 2011 January 3. They claimed a lag of 8 ± 3 days for the Hβ line in Mrk 6. We have first checked the effect of the removing of linear trends from our light curves (as recommended by some authors, e.g., Welsh 1999). We have removed linear trends from the Hβ and continuum light curves for each subinterval, even if there are no such trends exist. Then we have recalculated a mean lag value and it was to be 19 days, i.e. two days less. Then we have generated random time series (continuum and Hβ) by exactly the same way as described above, but for the sampling rate of Grier et al. in order to check whether the duration of the monitoring program is important for the lag measurements. We found that with the data sampling of Grier et al. our lag estimate must be less by one more day, and so a total difference between our and their results must be three days. The real difference is much larger than three days. An unexpected result of our simulation was very large lag uncertainties for the 125-days data sampling and for the triangular transfer function for the Hβ line (see above). The lag uncertainties were found to be as large as ±6 days! However, for the δ(τ − 20) transfer function (i.e., when the line light curve is simply a shifted version of the continuum light curve) the lag uncertainties were found to be as small as ∼ 0.1 days. So, for short-term campaigns and for transfer functions with a long tail (i.e., when the line light curve is not only shifted, but a strongly smoothed version of the continuum light curve), the uncertainties in lag estimates can be very large and they are connected to the extrapolation of the line and continuum fluxes when computing the CCF, not to the data sampling. We concluded that we can only explain the difference of three days between our and their lag measurements. Probably, the rest of the difference is due to real changes of lag or due to the measurement uncertainties and their underestimation.

It can be seen from Table 8 that the simulated lag values are almost the same for all subinterval. The expected lag value can be obtained by convolving the ACF with the transfer function and it was found to be: τ_{pk} = 20.7 days and τcn = 22.4 day in an excellent agreement with the simulation results. So, the large gaps in our time series do not shift the lag measurements.

Table 8. Comparison of the lag uncertainty estimates between the method of the random time series and the RSS method.

Interval τ_{pk} RSS τ_{cn} RSS r_{sim}

1 20.8^{+2.4}_{−2.1} 2.1 22.2^{+2.8}_{−2.8} 2.7 0.968

2 20.8^{+1.5}_{−1.6} 1.6 22.2^{+2.8}_{−2.8} 2.1 0.960

3 20.5^{+2.8}_{−2.8} 6.0 22.4^{+4.6}_{−4.6} 4.3 0.940

4 20.4^{+2.6}_{−2.6} 3.4 22.1^{+4.4}_{−4.0} 8.5 0.980

5 20.6^{+2.4}_{−2.7} 6.9 22.4^{+3.7}_{−3.5} 3.3 0.978

Table 9. The broad Hβ, and Hα line width measurements for 1993–2008. FWHM σ_{line} km s^{−1}

Hβ(mean-spectrum) 6278 ± 378 2821 ± 13 Hβ(RMS-spectrum) 5445 ± 468 2884 ± 97

Hα(mean-spectrum) 5322 ± 142 2870 ± 22 Hα(rms-spectrum) 4443 ± 338 2780 ± 35

4 LINE WIDTH MEASUREMENTS

It is well known that the emission-line profile evolution cannot be entirely attributed to the reverberation effect and that the profile changes usually occur on a time scale that is much longer than the flux-variability time scale (see Wanders & Peterson 1996). To decrease the effect of the long-term profile changes on the line width measurements and to get sufficient statistics, we measured the Hβ and Hα line widths for the five subintervals presented in Table 6. The line width is typically characterized by its full width at half maximum (FWHM) or by the second moment of the line profile, denoted as σ_{line}. To measure FWHM for the mean Hα and Hβ line profiles, we removed narrow lines from the broad line profiles. This is not required for rms profiles. However, the spectra must be optimally aligned in wavelength and in spectral resolution in order to reduce the narrow line residuals in the rms profiles. It is difficult to measure FWHM because both the mean broad and rms Hβ profiles are double-peaked, and so the scatter in the FWHM measurements is much larger than in σ_{line} which is well defined for arbitrary line profiles. The uncertainties in the line width were obtained using bootstrap method described by Peterson et al. (2004). The Hβ and Hα line width (both FWHM and σ_{line}) and their uncertainties are listed in Table 9 for 1993–2008. Table 10 gives the σ_{line} computed separately for each considered subinterval and for the Hβ line only.

We examined the relationship between the Hβ lag, Hβ width, and the continuum flux (see Fig. 5). No significant correlations among above three parameters were found. In particular, the virial relationship between the lag and width does not contradict to our data, but the correlation coefficient between them does not differ significantly from the zero value. More subintervals and less lag uncertainties are required.

12 V. T. Doroshenko et al.

Table 10. Results for the five subintervals

Time Mean Flux^a τ_{cn} σ_{line}km s^{−1} M^b_{BH} in units 10^8M_⊙ series F(5170) F(Hβ) days (mean) (rms) (mean) (rms) 1 2 3 4 5 6 7 8

1 6.446 3.632 21.2^{+4.0}_{−3.2} 2813±13 2836±48 1.77^{+0.33}_{−0.27} 1.80^{+0.34}_{−0.28}

2 6.472 3.976 20.7^{+3.0}_{−2.4} 2804± 6 2626±37 1.72^{+0.25}_{−0.20} 1.50^{+0.22}_{−0.18}

3 5.730 3.587 20.5^{+5.6}_{−7.0} 2808±14 2876±46 1.70^{+0.46}_{−0.58} 1.79^{+0.49}_{−0.61}

4 4.594 2.677 23.9^{+17.0}_{−7.3} 2870±13 3222±39 2.07^{+1.50}_{−0.63} 2.62^{+1.80}_{−0.80}

5 7.027 3.523 20.4^{+4.6}_{−4.1} 2807± 8 2864±35 1.69^{+0.38}_{−0.34} 1.77^{+0.40}_{−0.36}

Average: 21.1 ± 1.9 2812 ± 10^c 2882 ± 100^c 1.76 ± 0.16 1.85 ± 0.21

a Same flux units as in Table 1 for 5170 Å continuum and Hβ, respectively. b Using Onken et al (2004) calibration, f = 5.5.

c The line width and uncertainties were computed as weighted average and assuming different expectations of the line widths among individual periods of observations.

Figure 5. The relation between the continuum flux and the lag (τ_{cn}) for Hβ in Mrk 6, as well as between the Hβ width and the lag (τ_{cn}).

5 BLACK HOLE MASS OF MRK 6

Determination of the black hole mass from reverberation mapping rests upon the assumption that the gravity of the central super-massive black hole dominates over gas motions in the BLR. The black hole mass is defined by the virial equation MBH = f cτ (ΔV )^2 G , where τ is the measured emission-line time delay, c is the speed of light, cτ represents the BLR size, and ΔV is the BLR velocity dispersion. The dimensionless parameter f is the scaling factor, which depends on the BLR structure, kinematics and inclination of BLR. Peterson et al. (2004) argued that τcn for the time delay τ , and σ_{line}, measured from the Hβ emission line in the rms spectrum for the emission line width ΔV , provide the most robust estimates of the black hole mass with the reverberation technique. Later Collin et al. (2006) confirmed that in most cases for the black hole mass estimate the line dispersion σ_{line} is more suitable than the FWHM, and σ_{line} from the rms-spectrum is more suitable than the σ_{line} from the mean spectrum.

We adopt an average value of f = 5.5 based on the assumption that AGNs follow the same MBH −σ∗ relationship as quiescent galaxies (Onken et al. 2004). This is consistent with Woo et al. (2010) and allows easy comparison with previous results, but this is about a factor of two larger than the value of f computed by Graham et al. (2011). The value of f can be more decreased due to the effect of radiation pressure, as was explored by Marconi et al. (2008, 2009). Marconi et al. suggested that neglecting the effect of radiation pressure can lead to underestimation of the true black hole mass, especially in objects close to their Eddington limit. Discussion between Marconi et al. (2008, 2009) and Netzer (2009) shows that there are many unclear questions in this area. Naturally, a corrective term for radiation pressure will decrease the f-factor.

We calculated the black hole mass for Mrk 6 with the use of τcn = 21.1 ± 1.9 for the time delay averaged over five time intervals and σ_{line} = 2882 ± 100 km s^{−1} from the rms spectra for Hβ. With τcn taken in days and (ΔV ) in km s^{−1}, and taking into account the time dilation correction for the value of τcn, the mass is equal to: MBH /M⊙ = 0.1952 × f × τcn(obs) (1 + z)

× (ΔV )^2.

The black hole mass calculated from the Hβ line is (1.85 ± 0.21) × 10^8M⊙. For the Hα line, the τcn = 26.8 ± 7.7 days and σ_{line} = 2780 ± 35 km s^{−1} and the black hole mass is equal to (2.2±0.6) × 10^8M⊙.

The black hole masses calculated for each of five periods of observations are listed in columns 7 and 8 of Table 10 for the σ_{line} from the mean and rms spectra. One can see that all the estimates of the black hole mass based on the Hβ line are the same within the scatter.

6 THE BLR SIZE–LUMINOSITY AND MASS–LUMINOSITY RELATIONSHIPS

Many characteristics of the Mrk 6 galaxy are typical for active galaxies. In this connection, it is of interest to see the localization of this galaxy on the BLR Radius–Luminosity and Mass–Luminosity diagrams. These diagrams determine a relationship between fundamental characteristics of AGNs. To this end, the Mrk 6 luminosity should be known. Up to the present, for many AGNs the luminosity in the rest-frame λ0 = 5100 Å has been corrected for host-galaxy starlight

Black Hole Mass in Mrk 6 13

Figure 6. Surface brightness distribution for Mrk 6 in the Vband on the basis of multi-aperture photoelectric photometry by Neizvestny (1987). The solid curve corresponds to the model μ(r) = a + br + cr^{1/4}.

contribution within the apertures used in spectral observations (see Bentz et al. 2009a). These authors used highresolution Hubble Space Telescope (HST) images to measure the starlight contribution. This contribution was found to be significant, especially for low-luminosity AGNs.

We tried to get at least a rough estimate of the host-galaxy contribution using the observations made by Neizvestny (1987) at the Special Astrophysical Observatory (SAO) in October 1984 with different apertures from A=4.^{′′}3 to 55^{′′}. The surface brightness distribution in the host galaxy of the Mrk 6 nucleus calculated on the basis of these measurements is shown in Fig. 6.

The galaxy contribution in our 3^{′′}×11^{′′} spectral window was found to be V_{gal}=15.^m6 or F_{gal}=2.08×10^{−15} erg s^{−1}cm^{−2}Å^{−1}. The mean flux observed in the continuum near λ0=5100 Å is F_{(gal+nuc)}=6.093×10^{−15} ergs^{−1} cm^{−2}Å^{−1} (see Table 4) and, thus, the mean flux corrected for the galaxy contribution is equal to Fnuc=4.013×10^{−15} ergs^{−1}cm^{−2}Å^{−1}. The variability amplitude Fvar increases from 18% to 27% after accounting for the galaxy contribution. The mean flux was also corrected for Galactic reddening according to the NASA/IPAC Extragalactic Database (NED) Schlegel et al. (1998). The luminosity was found to be λL_λ(5100)=(2.51±0.78) × 10^{43} erg s^{−1} adopting the galaxy distance D=81 Mpc and when the galaxy contribution is removed.

The bolometric luminosity of the Mrk 6 nucleus was adopted to be L_{bol} ≃ 9λL_λ(5100Å) according to Kaspi et al. (2000) and it is equal to L_{bol}(nucl)=2.26 ×10^{44}erg s^{−1}. This luminosity is far from the Eddington limit (L_{Edd}), which is equal to L_{Edd}=2.16×10^{46} erg s^{−1} for a black hole mass of 1.8×10^8 M⊙. In other words, the Eddington ratio for Mrk 6 is L_{bol}/L_{Edd} ≃ 0.01. In this case and because there are no clear indications of gas outflow from the BLR, the radiation pressure has a negligible effect on the reverberation mass estimate.

The position of the Mrk 6 nucleus on the BLR Size– Luminosity diagram is shown in Fig. 7. The BLR size and the luminosity of other galaxies in Fig. 7 are taken from Bentz et al. (2009a) and Denney et al. (2010). The black hole masses in Fig. 7 are taken from Peterson et al. (2004), except for the galaxies Mrk 290, Mrk 817, NGC 3227,

Figure 7. Top: Hβ BLR size vs. luminosity at 5100Å according to Bentz et al. (2009a) and Denney et al. (2010). The luminosity of all nuclei was corrected for host galaxy contribution. The solid line is the best fit to the relationship log(R_{BLR} )=−21.3+0.519 log(L). Bottom: the Mass–Luminosity diagram. The black hole mass of the majority of AGNs was taken from Peterson et al. (2004), except for Mrk 290, Mrk 817, NGC 3227, NGC 3516, NGC 4051, and NGC 5548, for which new results by Denney et al. (2010) were used. Solid lines show the Eddington limit L_{Edd} and its 10% and 1% fractions. The position of Mrk 6 nucleus is indicated on both plots.

NGC 3516, NGC 4051, for which we used new data from Denney et al. (2010).

7 VELOCITY-RESOLVED REVERBERATION LAGS

7.1 Entire time interval: 1993–2008

The question about whether the direction of gas motion can be determined from the response of the line profile to the continuum changes was firstly raised by Fabrika (1980). Generally speaking, the BLR gas velocity field can be random circular orbits, radial gas outflow or infall, or Keplerian motion. Examples demonstrating how the velocity resolved responses can be related to different types of BLR gas kinematics are given in Peterson (2001) and Bentz et al. (2009b). The random circular orbits generate a symmetric lag profile with the highest lag observed around zero velocity. The infall kinematics produces longer lags in the blue-shifted emission,

14 V. T. Doroshenko et al.

Figure 8. Two top panels show the Hβ mean and rms profiles (left) and the Hα mean profile (right) divided into ten bins of equal flux separated by vertical dashed lines. The flux units for the mean and rms profiles are 10^{−13} ergs cm^{−2} s^{−1} Å^{−1}. The third panels from the top show the corresponding velocity-resolved time lag response, where the delays are plotted at the flux centroid of each velocity bin. Here the vertical error bars are 1σ uncertainties in the lag for each velocity bin denoted by the horizontal error bars. The horizontal dotted and dashed lines on the third panels mark the mean centroid lag and 1σ uncertainty, respectively, for the entire emission line. The bottom panels show the peak value of the correlation coefficient between the bin flux in the line and continuum. Here the horizontal dotted lines mark the correlation coefficient r_{max} between the entire emission line and the continuum, as calculated in Table 5.

and the outflow gas produces longer lags in the red-shifted emission.

Horne et al. (2004) formulated some important observational requirements for determining a reliable velocity field of the BLR: (1) the time duration of observations should be at least three times larger than the longest timescale of response, (2) the mean time between subsequent observations should be at least two times less than the BLR light-crossing time, and (3) the velocity sampling ΔV used for the velocitydelay maps should be no less than the spectral resolution of the data. According to Horne et al. (2004), such conditions can allow one to distinguish clearly between alternative kinematic models of the BLR gas motion.

In order to obtain the velocity-delay map, we measured the lag as a function of velocity in several bins across the line profile. We divided both the Hα and Hβ lines into ten bins of equal flux, and the width of these bins was no less than 1000–1500 km s^{−1}. For each bin we calculated light curves from the Balmer line fluxes. Then each of these light curves was cross-correlated with the continuum light curve following the same procedure as described in Section 3. Figure 8 shows hydrogen line profiles (mean and rms) subdivided into bins (two upper panels). The two middle panels demonstrate the lag measurements for each of the bins. The vertical error bars show 1σ uncertainties for the time lag, and the horizontal bars represent the bin width. The horizontal solid and dashed lines in the two middle panels show the mean BLR lag and associated errors as listed in Table 5. The bottom panels show the peak correlation coefficient between the bin flux in the line and continuum, rmax. Figure 8 shows that

(1) The mean and rms profiles of Hβ and Hα are not symmetric with respect to zero velocity. The centroid of the mean and rms profiles is shifted to the short-wave part of the line. The variable parts of Hβ and Hα have two welldefined peaks, one of them is almost central (between 5 and 6 bins) and another is blue-shifted. In addition, there is a weaker peak in the red part of the line profile.

(2) The time delay between the higher velocity gas in the BLR and the continuum is shorter than the delay between the low velocity gas and the continuum. Such a behaviour is typical for virialized gas motions.

(3) The lag in the blue wing of the Hβ line is greater than the lag in the red side of this line. The Hα velocityresolved lags shows the same tendency. This is consistent with expectations from the infall model of gas motion. Thus, it is possible we have virialized motion combined with infall signatures.

(4) The correlation coefficient of different segments of the lines is different. The bin corresponding to a radial velocity of Vr ≈ +1500 km s^{−1} shows poor correlation with the continuum variation, especially in Hβ. This fact was earlier noted by Sergeev et al. (1999).

7.2 Velocity delay maps in the five time intervals

We have computed the velocity-resolved time delays for the five time intervals given in Table 6. For each subset we made the velocity-dependent cross-correlation analysis for the Hβ line profile bins as described in the previous section. The Hβ line was selected because its sampling is better. In Figure 9 the mean and rms Hβ profiles, the velocity-resolved time lag response, and the velocity-dependent peak correlation coefficient are shown for the five time intervals. Upon inspection of Figure 9 it becomes clear that the mean and rms profiles are different among the five periods. The relative intensity in the blue peak and in the central peak changes very strongly: during the first interval the blue peak is higher then the red one. The opposite situation is seen in the fifth interval. The flux in continuum as well the flux in the Hβ line systematically decreased from the second to the fourth time interval, as is seen in Figure 3 and Figure 7. The Hβ rms profile shows two peaks in the first, second and third period, the flat top in the fourth period, and in the fifth period we see three peaks.

Figure 8 demonstrates that the high-velocity gas in the wings exhibits a shorter lag than the low-velocity gas, supporting the virial nature of gas motion in BLR: the gas kinematics that is dominated by the central massive object.

However, the lag is slightly larger in the blue wing than in the red wing for all subintervals. This is a signature of the infall gas motion. In the fifth period (2005–2008) the velocity delay map is more symmetric, but the seventh bin shows very small lag, as well as in the previous time interval. For 2005–2008 there is a poor correlation with the continuum for bins 7–10. A more detailed examination of the bin light curves for 2005–2008 (Figure 10) revealed that there is a trend for the Hβ flux in bins 7–10, which is almost absent in the bins 1–6. Following the advice of our

Black Hole Mass in Mrk 6 15

Figure 9. The same as in Figure 8, but for the Hβ line for the five time intervals.

Figure 10. Light curves in the continuum and Hβ in 2005–2008 over the velocity range from −6200 to +4500 km s^{−1} (top panels) as well as the light curves of the broad Hβ line in bin 5 in the velocity range from −980 to +25 km s^{−1}, and in the bin 7 in the velocity range from 1000 to 2000 km s^{−1} (bottom panels). The continuum fluxes are in units of 10^{−15} erg s^{−1} cm^{−2} Å^{−1}, and the broad emission line fluxes are in units of 10^{−15} erg s^{−1} cm^{−2}.

reviewer we removed the trend from the Hβ light curves for bins 7–10. No more significant trends were found for other time intervals. In Figure 9 the detrended lags and correlation coefficients are shown by open circles. After detrending procedure, the lag–velocity dependence became more similar to the lag–velocity dependence for the first period, for which the difference in lag between the blue and red wings is largest.

So, it is most likely that the BLR kinematic in Mrk 6 is a combination of the Keplerian gas motion and infall gas motion.

8 CONCLUSION

We have reported our new results on the Mrk 6 nucleus from 1998–2008 observational data together with the previous results published by Sergeev et al. (1999). We found that

(1) The flux of the Mrk 6 nucleus in 1992–2008 varied significantly in the continuum as well as in the Hα and Hβ broad emission lines. The relative amplitude of the continuum flux variability is larger than in the hydrogen lines, and it is greater in the Hβ line than in the Hα (see Table 4). It is typical for the most of Seyfert galaxies. This agrees with the predictions of Korista & Goad (2004) based on new photoionization calculations of the BLR-like gas.

(2) We found the average time delay between the total Hβ flux and the continuum flux at 5170 Å to be 21.1 ± 1.8 days, and the time delay does not vary significant among individual time intervals. It seems that the size of the Hβ emission region remains approximately the same over long time periods. The Hα flux responds to the changes in the F 5170 continuum with a lag of 26.8^{+10.6}_{−4.8} days.

(3) When the continuum flux varies, the photo-ionization models predict the existence of the relation between the BLR size and the luminosity. However, because the large uncertainties in the lag for individual time intervals we are unable to find such a relation. For the same reason, it is unable to obtain a dependence between the lag and line width, and it is impossible to check whether this dependence is consistent

16 V. T. Doroshenko et al.

with the dependence V ∝ r^{−1/2} expected for the gravitationally dominated motion.

(4) The Hβ line width is larger than that of Hα. This is naturally explained by photo-ionization calculations (e.g., Korista & Goad 2004): the effective emission region of Hβ is smaller and closer to the ionizing source than the effective region of Hα, and the gas velocities in Hβ are higher.

(5) By examining the velocity-resolved lags for the broad Hβ and Hα lines, we found that the lag in the high-velocity wings are shorter than in the line core. This indicates virial motions of gas in the BLR. However, the lag is slightly larger in the blue wing than in the red wing for the entire time interval as well as for the individual periods considered in the present paper. This is a signature of the infall gas motion. Probably the BLR kinematic in the Mrk 6 nucleus is a combination of the Keplerian gas motion and infall gas motion.

(6) Some profile segments often show poor correlation with the continuum flux. According to Gaskell (2010) this effect can arise because off-axis sources of ionizing continuum flux can appear, which might not make a detectable contribution to the total continuum flux variability, but they will have an influence on the line only over a narrow range of radial velocity in the BLR. If these local off-axis events will vary out of phase with the variability of the dominant source, the result will be to give a weak correlation between the continuum flux and the line flux in the narrow range of radial velocity.

(7) We determined the black hole mass from the lag and line width measurements of the Hβ and Hα lines. The mass was found to be MBH = (1.8 ± 0.2) × 10^8 M⊙ for the Hβ line and slightly greater and less reliable from the Hα line. Under such a mass and the luminosity of λL_λ(5100)=(2.51±0.38)×10^{43} erg s^{−1}, the Mrk 6 nucleus is located on the upper edge of the Mass-Luminosity diagram that corresponds to the Eddington ratio of about 0.01. This confirms the assumption (e.g., Sergeev et al. 2011) that there is anticorrelation between broad-line widths and Eddington luminosity ratio L_{bol}/L_{Edd}. The Mrk 6 position on the BLR Size–Luminosity diagram does not contradict the fit RBLR ∝ L^{0.5} determined by Bentz et al. (2009a).

ACKNOWLEDGMENTS

We thank the anonymous reviewer for useful comments and suggestions. We also thank S. Nazarov and the staff of 2.6-m and 0.7-m telescope for help during our observations. SSG acknowledges the support to CrAO in the frame of the ‘CosmoMicroPhysics’ Target Scientific Research Complex Programme of the National Academy of Sciences of Ukraine (2007–2012). VTD acknowledges the support of the Russian Foundation of Research (RFBR, project no. 09-02-01136a). The CrAO CCD cameras were purchased through the US Civilian Research and Development for Independent States of the Former Soviet Union (CRDF) awards UP1-2116 and UP1-2549-CR-03.

REFERENCES

Bentz M.C. et al., 2008, ApJ, 689, L21 Bentz M.C. et al., 2009a, ApJ, 697, 160

Bentz M.C. et al., 2009b, ApJ, 705, 199 Bentz M.C. et al., 2010, ApJ, 716, 993 Blandford R.D., McKee C.F., 1982, ApJ, 255,419 Collin S., Kawaguchi T., Peterson B.M.,Vestergaard M., 2006, A&A, 456, 75 Denney K.D., Peterson B.M., Pogge R.W. et al., 2009, ApJ, 704, L80 Denney K.D., Peterson B.M., Pogge R.W. et al., 2010, ApJ, 721, 715 Doroshenko V.T., 2003, A&A, 405, 903 Doroshenko V.T., Sergeev S.G., 2003, A&A, 405, 909 Doroshenko V.T., Sergeev S.G., Merkulova N.I., et al., 2005, Astrophysics, 48, 156 Fabrika S.N., 1980, Astron. Tsirk., No 1109, 1 Feldmeier J.J. et al., 1999, ApJ, 510, 167 Gaskell C.M., 2009, [arXiv:0910.3945] Gaskell C.M., 2010, [arXiv:1008.1057] Gaskell C.M., Sparke L.S., 1986, ApJ, 305, 175 Graham A.W., Onken Ch.A., Athanassoula E. and Combes F. 2011, MNRAS, 412, 2211 Horne K. et al., 2004, PASP, 116, 465 Immler S., Brandt W.N., Vignall Cr., et al., 2006, AJ, 126, 153 Kaspi S., Smith P.S., Netzer H. et al., 2000, ApJ, 533, 631 Khachikian E. Ye.&Weedman D.W., 1971, ApJ, 164, L109 Kharb P., O’Dea C.P., Baum S.A., Colbert E.J.M., Xu C., 2006, ApJ, 652, 177 Kharitonov A.V., Tereshchenko V.M., Knyazeva L.N., 1988, Spectrophotometric Catalogue of Stars, Science, Moscow: Nauka Koratkar A.P., Gaskell C.M., 1991, ApJS, 75, 719 Korista K.T., Goad M.R., 2004, ApJ, 606, 749 Kukula M.J., Holloway A.J., Pedlar A., et al., 1996, MN- RAS, 280, 1283 Malizia A. Bassani L., Capalbi M., et al., 2003, A&A, 406, 105 Marconi A., Axon D.J., Vaiolino R. et al., 2008, ApJ, 678, 693 Marconi A., Axon D.J., Vaiolino R. et al., 2009, ApJ, 698, L103 Neizvestny S.I., 1987, Izv.SAO, 24, 3 Netzer H., 2009, ApJ, 695, 793 Onken C.A., Ferrarese L., Merritt D. et al., 2004, ApJ 615, 645 Peterson B.M., 1988, PASP 100, 18 Peterson B.M., 2001, [arXiv: astro-ph/0109495] Peterson B.M., Farrarese L., Gilbert K.M. et al., 2004, ApJ, 613, 682 Peterson B.M., Wanders I., Horne K., et al., 1998, PASP 110, 660 Schlegel D.J., Finkbeiner D.P., Davis M., 1998, ApJ, 500, 525 Schurch N.J., Griffits R.E., Warwick R.S., 2006, MNRAS, 371, 211 Sergeev S.G., Pronik V.I., Sergeeva E.A. Malkov Yu.F., 1999, ApJS, 121, 159 Sergeev S.G., Doroshenko V.T., Golubinskiy Yu.V., et al., 2005, ApJ, 622, 129 Sergeev S.G., Klimanov S.A., Doroshenko V.T. et al., 2011, MNRAS, 410, 1877 Wandel A., Peterson B.M., Malkan M.A., 1999, ApJ, 526, 579

Black Hole Mass in Mrk 6 17

Wanders I. & Peterson B.M., 1996, ApJ, 466, 174 Welsh W.F., 1999, PASP, 111, 1347 White R.J., Peterson B.M., 1994, PASP, 106, 879 Woo J.-H., Treu T., Barth A.J. et al., 2010, ApJ, 716, 269