arXiv:1111.3814v1 [astro-ph.GA] 16 Nov 2011

AKARI/IRC Broadband Mid-infrared data as an indicator of Star Formation Rate

Fang-Ting Yuan^1, Tsutomu T. Takeuchi^1, Véronique Buat^2, Sébastien Heinis^2, Elodie Giovannoli^2, Katsuhiro L. Murata^1, Jorge Iglesias-Páramo^{3,4} and Denis Burgarella^2 1Division of Particle and Astrophysical Sciences, Nagoya University, Furo-cho, Chikusa-ku, Nagoya 464–8602, JAPAN yuan.fangting, takeuchi.tsutomu, murata.katsuhiro@g.mbox.nagoya-u.ac.jp 2Laboratoire d’Astrophysique de Marseille, OAMP, Université Aix-Marseille, CNRS, 38 rue Frédéric Joliot-Curie, 13388 Marseille cedex 13, FRANCE veronique.buat, sebastien.heinis, elodie.giovannoli, denis.burgarella@oamp.fr 3Instituto de Astrofísica de Andalucía (IAA - CSIC), Glorieta de la Astronomía s.n., 18008 Granada, SPAIN 4Centro Astronómico Hispano Alemán, C/ Jesús Durbán Remón 2-2, 04004 Almería, SPAIN jiglesia@iaa.es

(Received ; accepted ) Abstract AKARI/Infrared Camera (IRC) Point Source Catalog provides a large amount of flux data at S9W (9 μm) and L18W (18 μm) bands. With the goal of constructing Star-Formation Rate(SFR) calculations using IRC data, we analyzed an IR selected GALEX-SDSS-2MASS-AKARI(IRC/Far-Infrared Surveyor) sample of 153 nearby galaxies. The far-infrared fluxes were obtained from AKARI diffuse maps to correct the underestimation for extended sources raised by the point-spread function photometry. SFRs of these galaxies were derived by the spectral energy distribution fitting program CIGALE. In spite of complicated features contained in these bands, both the S9W and L18W emission correlate with the SFR of galaxies. The SFR calibrations using S9W and L18W are presented for the first time. These calibrations agree well with previous works based on Spitzer data within the scatters, and should be applicable to dust-rich galaxies.

Key words: infrared: galaxies – ISM: dust, extinction – stars: formation

1. Introduction

The star formation activity is fundamental to studies on the formation and evolution of galaxies. Numerous efforts have been made to find reliable and convenient SFR indicators (e.g. Kennicutt, 1998; Hirashita et al., 2003; Bell, 2003; Hopkins et al., 2003; Calzetti et al., 2007). Among most frequently used indicators, the ultraviolet (UV) and the optical recombination lines (e.g. Hα, Paα) give direct measures of light from young stars. However, UV and Hα emissions are strongly affected by dust extinction (Kennicutt, 1998), and Paα as well as other optical recombination lines were also shown to underestimate SFRs for galaxies with high luminosity (Rieke et al., 2009). On the other hand, since dust absorbs UV/optical light and re-emits the bulk of the energy into far-infrared (FIR) band (25 μm ∼ 350μm), FIR emission could efficiently trace SFRs for dusty galaxies. However, FIR emission is unable to trace the dustunobscured radiation and includes part of radiation from old stellar populations. Therefore the energy balance method combining the FIR and UV derived SFRs were used to complement the emission from young stars not traced by FIR (e.g. Buat & Xu, 1996; Meurer et al., 1999; Gordon et al., 2000; Buat et al., 2005). Although this method could trace SFRs with considerable accuracy, it is difficult to obtain the total dust emission especially for high redshift objects.

The MIR monochromatic fluxes were also investigated as SFR indicators. The MIR emission is contributed by several components, including the polycyclic aromatic hydrocarbon (PAH) features (prominent at 6.2, 7.7, 8.6, 11.3, 12.7 and 17 μm), the continuum by the stochastic heating of very small grains, silicate absorption at 9.7 and 18 μm, molecular hydrogen lines and fine-structure lines (Leger & Puget, 1984; Leger et al., 1989; Desert et al., 1990; Draine & Li, 2007; Smith et al., 2007; Treyer et al., 2010). The MIR-SFR relation was intensively studied using Spitzer IRAC 8 μm and MIPS 24 μm photometry data and spectral data (e.g. Förster Schreiber et al., 2004; Calzetti et al., 2005, 2007; Kennicutt et al., 2009; Rieke et al., 2009; Treyer et al., 2010). Nevertheless, there is still a debate about the reliability of MIR indicators because of the complicated features it contains. Attempts to combine the optical and IR indicators show that this combination could trace the SFR effectively, and notably reduce the scatter (e.g. Calzetti et al., 2007; Zhu et al., 2008; Kennicutt et al., 2009). However, factors of the combination are different in each work.

The recently released AKARI/IRC Point Source Catalogue Version β-1 (hereafter IRCPSC) provides positions and fluxes of all-sky survey at S9W (9 μm) and L18W (18 μm) bands (Ishihara et al., 2010). For numerou MIR data, it would be useful if there is a benchmark of SFR measurement. Comparing with Spitzer 8 and 24 μm bands, the AKARI IRC S9W and L18W bands cover wider wavelength ranges, including silicate absorption features at both bands and emission contributed by large PAH molecules at the L18W band. This work is dedicated to investigate whether and to what degree AKARI broadband MIR data could trace SFRs, and how much the inclusion of silicate absorption and longer wavelength PAH features would be.

Start from a sample with multi-wavelength observation flux, we derive the SFR for each galaxy by the spectral energy distribution (SED) fitting. MIR data were correlated with the SFRs to built the SFR calibrations. Then the results were compared with those from the Spitzer observation. The present paper is organized as follows: Section 2 introduces the GALEX-SDSS- 2MASS-AKARI sample. Section 3 gives a short introduction to methods for calculating SFRs. The MIR-SFR relations and some comparisons between AKARI and Spitzer are reported and discussed in Section 4. Conclusions are given in Sections 5.

2. Data

2.1. Construction of the multi-wavelength sample

We cross-identified^1 IRCPSC with multi-wavelength data constructed by Takeuchi et al. (2010) to obtain a sample including MIR photometric measurements. The original sample was based on a selection by IRAS-PSCz (Saunders et al., 2000) and AKARI/FIS Bright Source Catalog (hereafter FISBSC) data (Yamamura et al., 2008, 2009), which means all these galaxies have considerable fluxes at FIR. Then these galaxies were cross-matched with observations by GALEX, 2MASS and SDSS. Fluxes at the UV band were obtained by performing specific aperture photometry so as not to shred GALEX images. A detailed description of the original sample can be found in Takeuchi et al. (2010).

IRCPSC presents flux data at 9 μm and 18 μm that have an effective bandwidth of 4.10 μm and a detection limit of 50 mJy, and 9.97 μm and 90 mJy, respectively (Ishihara et al., 2010). After cross-identification, there were 162 galaxies with a flux of either 9 μm or 18 μm. However, nine galaxies were found to have inconsistent fluxes at GALEX, SDSS or 2MASS band according to their SEDs, possibly due to the measurement errors or the misidentification of objects caused by the inhomogeneous resolution of each observation; they were omitted from our sample. We also discarded one galaxy with a too-small redshift (z ∼ 0.0008). The summary of the sample is listed in Table 1. Searching in the SIMBAD database, most of galaxies in our sample are normal star forming galaxies: Only 15 galaxies are classified as AGNs (including Seyfert 1 and Seyfert 2 galaxies). All the galaxies in our sample are nearby ones. The distribution of the redshift is shown in Figure 1. 2.2. The Re-estimation of AKARI FIR Data

The FISBSC flux density for extended sources would be no longer accurate because of the point source extraction procedure. In our sample, a considerable fraction of galaxies is the extended source. Therefore, it is questionable whether the catalog data of these sources are reliable. This is confirmed by making a comparison between FISBSC fluxes and IRAS co-

1 The searching radius is set at 36^{′′} considering the original sample’s position accuracy.

Fig. 1. The redshift distribution of our sample. The filled area denotes AGNs.

added fluxes (Figure 2), which were specially calculated for extended sources (Saunders et al., 2000). In order to investigate the dependence of FISBSC flux on the extension of the galaxy, the sample was divided into three sub-samples according to the size of the galaxy (Table 2). The lines in Figure 2 give predictions of the difference between two different bands by Dale & Helou (2002) (hereafter DH) one-parameter constrained SED templates. The parameter α is related to IRAS flux ratio f_{60}/f_{100}. The log(f_{60}/f_{100}) in our sample ranges from −0.60 to 0.25, and most of the galaxies have log(f_{60}/f_{100}) between −0.5 and 0.0, corresponding to an α value between 2.625 and 1.375. Accordingly, the model prediction with α = 1.375, 2.625 and the median value 2.0 are illustrated in Figure 2. Table 3 presents the median values of log(f_{AKARI}/f_{IRAS}) for each sub-sample. Compared with the model predicted values, there are clear discrepancies between FISBSC and IRAS data, especially for 60−65 μm and 90−100 μm. Also note that the large galaxies show greater discrepancies than small ones, indicating the PSF photometry is less reliable for larger galaxies, because a considerable part of their flux is left out by the relatively small beam size.

Aiming to obtain more reliable flux data, the photometry of the diffuse maps provided by the AKARI group was conducted using SExtractor. The obtained “AUTO” fluxes were also compared with IRAS co-added fluxes.

In the 90 μm band, the result shows a great improvement on the consistency with the IRAS flux according to the DH model (Figure 3 and Table 3) for all galaxies in our sample. At 65 and 140 μm bands, the consistency is improved for those galaxies in ‘Medium’ and ‘Large’ subsamples, whereas the dispersion increases for the galaxies in ’Small’ samples. Less improvement is found at 140 μm band, which can be explained by the relatively larger PSF FWHM at this band (∼ 60^{′′}, as compared with ∼ 39^{′′} for the 65 and 90 μm bands, Kawada et al., 2007). At the 160 μm band, neither fluxes derived from the diffuse maps nor those from the

Fig. 2. Comparison between FIS catalog flux and the IRAS flux. Galaxies in different sub-sample are shown in different sizes (large open circles: large; small open circles: medium; dots: small). The DH models with three different α are shown in different lines (dashed:α = 1.375; solid: α = 2.0; dash-dotted: α = 2.625).

IRCPSC are satisfying, which is due to the poor quality of this band, thus 160 μm data were not used in the following work. Therefore, we kept IRCPSC flux values for ‘Small’ sources at the 60 and 140 μm bands, and applied fluxes derived from diffuse maps to the other sources. In addition, fluxes derived from AKARI diffuse maps showed notably smaller measurement errors than the IRAS fluxes, greatly improving the data quality. Considering taht the IRAS fluxes provide information similar to that given by the AKARI bands, we omitted IRAS fluxes when fitting the SEDs.

Note that the MIR data provided by IRCPSC were little affected by an extension of the source, since it applies “AUTO” fluxes by SExtractor, which are suitable for both point sources and extended sources.

Fig. 3. Comparison between FIS diffuse map flux and the IRAS flux. Symbols are of the same meaning as in Figure 2

3. SFR Calculation

The SED fitting program CIGALE (Noll et al., 2009) was used to calculate the SFR for our sample. CIGALE was developed to derive highly reliable galaxy properties by fitting the UV/optical SEDs and the related dust emission at the same time, i.e., the stellar population synthesized models are connected with infrared templates by the balance of the energy of dust emission and absorption. A detailed description of CIGALE can be found in Noll et al. (2009); Buat et al. (2010); Giovannoli et al. (2011). Here we give a brief introduction to the main features.

CIGALE allows one to use the stellar SEDs from models given either by Maraston (2005) or by Fioc & Rocca-Volmerange (1997, PEGASE). The difference between these models is the contribution of the thermally pulsating asymptotic giant branch (TP-AGB) stars. In PEGASE models, the contribution from TP-AGB stars is low (Maraston et al., 2006). Maraston (2005) increased the contribution from TP-AGB stars adopting the ’fuel consumption’ approach. Maraston et al. (2006) shows that the insufficient consideration of TP-AGB stars overestimates the stellar mass by 0.2 dex and worsens the consistency with IR observation 6 data at a redshift of z ∼ 2. At lower redshift, it is found that using different models little affects the results (Rettura et al., 2006; Eminian et al., 2008). Therefore, the models from Maraston (2005) were preferred in this work. The Kroupa IMF (Kroupa, 2001) was used to calculate the complex stellar populations (CSPs).

This code provides two scenarios of star formation: One is “box models” with a constant SFR, the other is “τ models”, for which SFR decreases exponentially with a typical decay time, τ. SFR is calculated as SFR_{box} = M_{gal}/t for “box models” and SFR_τ = M_{gal}/[τ(e^{t/τ} − 1)] for “τ models”, where M_{gal} is the galaxy mass (Noll et al., 2009). CIGALE also allows one to apply different scenarios for young and old populations. The input SFH here is a constant burst SFH for young stellar populations, and an exponentially decreasing one for old stellar populations. Thus SFRs were calculated using the formula f_{ySP} · SFR_{box} + f_{oSP} · SFR_τ , where f_{ySP} and f_{oSP} are fractions of young stellar populations and old stellar populations, respectively.

The attenuation curve adopted by CIGALE is based on a law given by Calzetti et al. (2000), with modification of the slope and/or adding a UV bump. The modification of the slope is controlled by the factor (λ/λ_V )^δ, i.e., by changing δ, the slope of the attenuation curve can be modified. We only considered a modification of the slope of the attenuation law here, and no bump was introduced. CIGALE allows one to consider different effects of attenuation for old and young stellar populations by adding the reduction factor f_{att} of the dust attenuation for the old stellar populations as an input parameter. For the IR part, CIGALE uses DH models, which is described in Section 2. Then the dust emission was calculated, and by balancing the energy emitted and absorbed, the short and long wavelength parts of the model were connected.

To compute the output parameters the code provides two methods: “sum” and “max”. The former calculates the probability distribution functions (PDFs) by taking sums of the probability of the models in given bins of parameter space, which might cause an unintentional bias when the input parameter values are badly chosen. The latter introduces a fixed number of equally sized bins for each parameter and searches the maximum probability of models in each bin. Then these maximum probabilities are taken as weights for individual bins to calculate the expectation value of the parameter. The advantage of this method is that it alleviates the dependence on the choice of parameters (see Noll et al., 2009, for detail). Therefore, we applied the “max” method in this work.

The input parameters applied in this study were adopted from Buat et al. (2010) in order to obtain a stable and reliable output. Since CIGALE is unable to trace the unobscured emission of an AGN, for Seyfert 1 galaxies, the output decreases the reliability (Buat et al., 2010). For dust-obscured AGNs, CIGALE provides models to fit the SED, and can avoid introducing any severe bias. Therefore, five Seyfert 1 galaxies were rejected in our sample, and other AGNs are marked during analysis. In order to keep the accuracy of derived SFRs, galaxies with relatively large discrepancies between observation and output spectra (reduced χ^2 > 10) were discarded as being unreliable. At first running, there were 25 such galaxies. By

Fig. 4. The comparison between SFRs derived from CIGALE code and from the mock galaxies.

updating the SDSS data using Navigator of SDSS DR7/8 instead of the original pipeline data from SDSS DR7, the reduced χ^2 values of 17 galaxies decreased to less than 10.^2 Four of the eight remaining galaxies had very poor quality of AKARI diffuse maps. The other four had large extension and brightness, which could cause incomplete flux derivation or saturation in the optical plates. Considering that the number was small (∼ 6%), these eight galaxies and five out of the 17 galaxies were discarded. Therefore, reliable SFRs were derived for 140 galaxies, out of which there are 112 with available 9 μm fluxes and 97 with 18 μm fluxes. 3.1. The reliability of the results

For a SED fitting, the accuracy of the output depends on the input parameters. To give proper estimates of the SFRs, the robustness of the results must be tested. A straightforward way to check the reliability of the output of CIGALE is to use a sample of mock galaxies with comprehensively known physical parameters. Mock galaxies can be generated following a recipe in Giovannoli et al. (2011): 1, Run CIGALE on the data of real galaxies. For each galaxies, a best model is produced by χ^2 minimization. Then, from these models, the fluxes at each bands can be estimated. 2, Add to each flux a random relative error, which is normally distributed with σ = 0.1. Thus, we obtain a mock catalog with flux information at every photometric band used in this study. The last step is to run the code on the mock catalog and then to compare the output parameters with the exact values provided by the best models. The result of the comparison is shown in Figure 4. We only present the result concerning SFRs because in this work the SFR is the only parameter that needs to be of concern. Figure 4 shows the two quantities are well related, indicating SFRs derived here are reliable.

As discussed in Noll et al. (2009), CIGALE could provide stable results of SFRs as long as one constraint beyond PAH band is given. We ran CIGALE with and without MIR data to examine the influence on SFR by MIR photometric data. The result shows adding the MIR

2 There is no modification for other sources which are fitted well.

Fig. 5. The comparison between SFR derived with and without MIR data. AGNs are shown as triangles.

data or not adding has almost no influence on the resulting value of SFR (Figure 5), while not using FISBSC data brings large uncertainties to the output, consistent with the conclusion of Noll et al. (2009) using SINGS sample.

4. Result and Discussion

Apparently, the luminosity at 9 μm and 18 μm L_9 and L_{18}^3 both correlate with SFRs (Figure 6 and Figure 7); the Spearman’s correlation coefficients are 0.943 for the L_9-SFR relation and 0.956 for the L_{18}-SFR relation^4. Linear regressions following the method provided by Kelly (2007) give: log SFR M_⊙/yr = (0.99 ± 0.03)log

L_9 L_⊙ − (9.02 ± 0.32) (1) and log SFR M_⊙/yr = (0.90 ± 0.03)log

L_{18} L_⊙ − (8.03 ± 0.30). (2)

The scatters of the data points about the regression lines of Equations 1 and 2 are approximately the same, with σ = 0.18 dex for 9 μm and 0.20 dex for 18 μm. These tight correlations also hold for the surface densities of luminosities and SFRs (Figures 8 and 9). The correlation coefficients are 0.961 for 9 μm and 0.945 for 18 μm. The areas of galaxies were calculated from g-band images of SDSS. The regression gives: log Σ_{SFR} M_⊙yr^{−1}kpc^{−2}

= (1.02 ± 0.03)log

Σ_9 L_⊙kpc^{−2}

3 In this paper, L_λ refers to νL_ν at wavelength λ.

4 Pearson’s correlation coefficient is 0.944 for L_9-SFR relation and 0.951 for L_{18}-SFR relation

Fig. 6. The 9 μm luminosity-SFR relation. The dashed line shows the fitting result. The triangles are AGNs.

Fig. 7. The 18 μm luminosity-SFR relation. Lines and symbols share the same meaning with Figure 6.

− (9.30 ± 0.19) (3) with σ = 0.18, and log Σ_{SFR} M_⊙yr^{−1}kpc^{−2}

= (0.98 ± 0.04)log

Σ_{18} L_⊙kpc^{−2} (4) − (8.89 ± 0.25). (5) with 0.22.

Figures 6 and 7 show that AGNs share a MIR-SFR relation similar to normal starforming galaxies, although the radiation mechanism of AGNs is different from normal galaxies.

Fig. 8. The surface densities of 9 μm luminosity-SFR relation. The dashed line shows the fitting result. The triangles are AGNs.

Fig. 9. The surface densities of 18 μm luminosity-SFR relation. Lines and symbols share the same meaning with Figure 6.

Fig. 10. The filter response curves of AKARI 9 μm and 18 μm bands (dashed line) and Spitzer 8 μm and 24 μm bands (dotted line). The solid line is the luminosity weighted average spectrum of star forming galaxies from Smith et al. (2007).

The slopes of the logL_9-logSFR and logL_{18}-logSFR relations derived here are almost equal to one, indicating the MIR-SFR relations are close to linear. 4.1. Comparison with SFR calibrations from Spitzer data

Spitzer 8 μm and 24 μm data were investigated as SFR tracers by several authors (e.g Wu et al., 2005; Pérez-González et al., 2006; Calzetti et al., 2007; Relaño et al., 2007; Zhu et al., 2008; Rieke et al., 2009). The 24 μm fluxes were found to be tightly related to the emission of the warm dust, and thus more intensively investigated, whereas the 8 μm-SFR relation is more complicated, strongly depending on such as the metallicity, size and star-formation history (Calzetti et al., 2007), therefore, there are fewer calibrations.

The main difference between the AKARI and Spitzer filters is their bandwidths. Due to the wider band, AKARI 9 μm and 18 μm fluxes are more affected by silicate absorption, PAH and molecular hydrogen line emissions (Figure 10). In order to check the reliability of our calibrations, the SFRs derived from Equations 1 and 2 were compared with those given by Spitzer calibrations. The work to compare was chosen to keep the luminosity range close to the present sample (Table 4). The calibrations given by Wu et al. (2005) and Zhu et al. (2008) are based on an equation given by Kennicutt (1998) in which Salpeter IMF was used. The use of Salpeter IMF will cause smaller SFRs by ∼ 0.18 dex than some other IMF with a more shallow slope at low masses (Rieke et al., 2009). Therefore this effect was corrected for the results of Wu et al. (2005) and Zhu et al. (2008).

4.1.1. Comparison between SFRs derived from 9 μm and from 8 μm

Spitzer 8 μm fluxes were computed from the output spectra of the CIGALE and filter response curves of Spitzer IRAC and MIPS. Since the 8 μm fluxes used in the calibration given in Table 4 were the dust emission with the stellar contribution subtracted following the recipe of Helou et al. (2004), the 3.6 μm flux was also calculated to compute the stellar composition contained in 8 μm, and thus 8 μm dust emission could be obtained (hereafter, we refer to 8 μm dust emission as 8 μm emission for conciseness). Note that here the stellar contribution is very 12

Fig. 11. Comparison between the SFRs derived from 9 μm emission (Equation 1) and from 8 μm emission by Wu et al. (2005) (crosses) and Zhu et al. (2008) (circles).

small, which can only affect the result by ∼ 0.02 dex. The obtained flux is then converted to SFR by formula given by previous work (Table 4). The results are plotted in Figure 11 (The typical 1σ uncertainty for the galaxy of median luminosity is ∼ 0.5 dex). The statistical information of the comparison is given in Table 5.

The discrepancy between our results and Wu et al. (2005) may due to several reasons. Wu et al. (2005) listed factors such as the accuracy of fiber aperture corrections, the validity of the estimation of the obscuration in galaxies by using Balmer decrement, the possible contamination to radio and MIR emission from obscured weak AGNs. The larger capacity of our sample (79 for 8 μm in Wu et al. (2005) compared with 112 in our sample) and the wider coverage of 9 μm band may also cause such difference. Another possible reason is that the oversimplification of PAH emission in DH models underestimates the 8 μm flux and therefore gives smaller SFRs. However, this level of discrepancy is well within the scatters in Equations 1.

The discrepancy between Wu et al. (2005) and Zhu et al. (2008) is because Zhu et al. (2008) included 8 μm-weak HII galaxies with lower MIR luminosity (Zhu et al., 2008). Since no such galaxies were included in present sample, it is reasonable that present result agrees with Wu et al. (2005) better.

4.1.2. Comparison between SFRs derived from 18 μm and 24 μm

For a 18 μm–24 μm SFRs comparison, more reference calibrations are available (Table 4). The 24 μm fluxes are also derived from the output spectra of the SED fitting by CIGALE. The statistical information of the comparison is given in Table 6. The converted SFRs are plotted in Figure 12. Since the SFRs derived from Wu et al. (2005) are quite similar to those from Zhu et al. (2008) and the luminosity range in Wu et al. (2005) is closer to this work, the results from Zhu et al. (2008) are omitted for the sake of brevity. 13

Fig. 12. Comparison between the SFRs derived from 18 μm (Equation 2) and from 24 μm emission by Wu et al. (2005) (crosses), Calzetti et al. (2007) (triangles) and Rieke et al. (2009) (dots). The dotted line gives the lower limit where the calibration of Rieke et al. (2009) applies.

The results of Wu et al. (2005) and Zhu et al. (2008) agree well with our result after the correction of IMF. Rieke et al. (2009) assembled SED templates for local luminous and ultraluminous infrared galaxies and combined the result of Dale et al. (2007) and Smith et al. (2007) to produce templates at lower luminosities. Their result is applicable to galaxies with 24 μm luminosity greater than 6 × 10^8 L_⊙, corresponding to log SFR = −0.33, which is shown by the dotted line in Figure 12. The present result agrees very well with Rieke et al. (2009) above the limit.

Our result is a little higher than the one given by Calzetti et al. (2007). A possible reason is that the result of Calzetti et al. (2007) was derived for HII clouds by Paα emission, which might be poorly applied to galaxy-wide calculations, because the diffuse MIR or Paα emissions in the whole galaxy are not included (Alonso-Herrero et al., 2006; Calzetti et al., 2007; Kennicutt et al., 2007; Rieke et al., 2009). 4.2. Combination of FUV and MIR indicators

At lower IR luminosity, the IR indicator may fail to trace part of the UV photons from young stars due to the increased transparency of the ISM. A combination of unobscured FUV and MIR luminosities, (FUV + αMIR), may efficiently compensate for the lost energy, and could trace the SFR linearly (Zhu et al., 2008). However, upon converting SFRs to dust obscuration corrected FUV fluxes by eq.[1] from Kennicutt (1998), we find that α = 2.53 and 3.33 with a scatter of 0.17 dex for 9 μm and 0.20 dex for 18 μm, respectively. The scatter is not reduced significantly. This fact indicates that the origin of the scatter in MIR-SFR diagram is complicated: not only the untraced UV photons, but also other unknown factors, such as the variation of the physical conditions within each galaxy, the distribution of dust and photo dissociation regions (PDRs), etc. 4.3. Metallicity

We attempt to investigate the gas-phase metallicity range of our sample by searching in the metallicity database measured by Tremonti et al. (2004) for SDSS galaxies. Unfortunately, the 12 + log(O/H) values are given for only 33 galaxies (all higher than 8.75). Therefore, we applied a compromised method: to investigate the stellar mass M_∗ of our sample. Measured by CIGALE, the stellar mass M_∗ of all the galaxy in the sample is larger than 10^{8.5} M_⊙. Thus, from mass-metallicity relation given by Tremonti et al. (2004):

12 + log(O/H) = − 1.492 + 1.847(logM_∗) − 0.08026(logM_∗)^2, (6) the metallicity 12 + log(O/H) for our sample is higher than 8.4. This is not surprising because the initial sample from Takeuchi et al. (2010) is IR selected, which means a considerably high luminosity in IR and thus sufficient dust content and relatively high metallicity range. Thus, the MIR-SFR relations derived here could only be extrapolated to other high-metallicity galaxies. The situation for low metallicity galaxies is rather complicated; since the opacity of the galaxy decreases, MIR would be unable to trace most of the UV/optical photons and thus lose the ability as an SFR indicator (Calzetti et al., 2007). 4.4. AGNs

Although AGNs have distinct features from normal galaxies in various physical properties, they share the same trend in the MIR-SFR figures. A possible reason is that the contribution from AGN component is minor (from SED fitting, less than 15%), therefore the host galaxy component dominates the spectrum. To investigate the effect of AGNs on MIR emission, we plot average SEDs for AGNs and normal galaxies in Figure 13. On average, AGNs are brighter than normal galaxies at all bands, while with a lower MIR/90 μm ratio (Table 7). There are two possible reasons: 1, silicate absorption occurs more strongly in AGNs. 2, PAH molecules are destroyed by the harsh radiation field in AGNs. The latter is more convincing. Studies show that small PAH molecules contributed to shorter wavelength MIR emission are destroyed more easily than large ones contributed to longer wavelength MIR emission (Smith et al., 2007; Treyer et al., 2010, and reference therein), which is consistent with the lower 9 μm flux value than 18 μm in Figure 13. Nevertheless, these differences between AGNs and normal galaxies are only on their average level, which could not be used to distinguish AGNs and normal galaxies in individual cases.

Fig. 13. The average SED (dashed lines) and the SED normalized at 90 μm (solid lines) of AGNs (solid symbols) and normal galaxies (open symbols).

5. Conclusion

We combined AKARI/IRC 9 μm and 18 μm data with a previous sample to construct a FIR selected multi-wavelength sample with MIR photometric measurements. The FIR data of AKARI/FIS in the original sample were re-estimated by photometry of AKARI diffuse maps to correct the bias of PSF photometry for extended sources. Then, the SEDs of the sample were fitted by CIGALE, and the SFRs were obtained. Regression analysis was conducted to investigate MIR-SFR relations. SFRs converted from AKARI MIR fluxes were compared with those from the Spitzer MIR fluxes to test the reliability of AKARI MIR-SFR calibrations. From the result, we draw the following conclusions:

1. Both 9 μm and 18 μm luminosities correlate with SFRs, and thus could be converted SFRs.

2. A combination of FUV and MIR luminosity barely reduces the scatters, indicating that the unobscured UV photons are not the only reason of the variation of MIR-SFR relation.

3. A comparison of the SFRs derived from Equations 1 and 2 with the ones derived from Spitzer MIR-SFR relations shows that the silicate absorption included in S9W (9 μm) and L18W (18 μm) bands little affects the results. The discrepancies, if any, are well within the uncertainties.

4. AGNs in the sample show no discrepancy with normal galaxies in the MIR-SFR diagrams.

The smaller average MIR fluxes for AGNs than normal galaxies might indicate the small PAH molecules are destructed by harsh radiation from AGNs.

In summary, for IR selected galaxies the rest frame 9 μm and 18 μm emissions are efficient tracers of SFRs, and the equations derived here should be applicable to other dust rich galaxies.

This work is based on observations with AKARI, a JAXA project with the participation of ESA. FTY, TTT, and KLM are partially supported from the Grand-in-Aid for the Global COE Program “Quest for Fundamental Principles in the Universe: from Particles to the Solar System and the Cosmos” from the Ministry of Education, Culture, Sports, Science and Technology (MEXT). TTT has been supported by Program for Improvement of Research Environment for Young Researchers from Special Coordination Funds for Promoting Science and Technology, and the Grant-in-Aid for the Scientific Research Fund (20740105) commissioned by the MEXT of Japan. VB and DB have been supported by the Centre National des Etudes Spatiales (CNES) and the Programme National Galaxies (PNG). JIP is supported by the grant AYA2007-67965-C03-02, from the Spanish MICINN. This work makes use of the SIMBAD database, operated at the Centre de Dones astronomiques de Strasbourg (CDS), Strasbourg, France. We acknowledge Y. Doi for preparing diffuse maps for our sample and Y. Matsuoka for helpful advice and comments. We also thank the anonymous referee for constructive suggestions to improve this paper.

References

Alonso-Herrero, A., Rieke, G. H., Rieke, M. J., Colina, L., Pérez-González, P. G., & Ryder, S. D. 2006, ApJ, 650, 835 Bell, E. F. 2003, ApJ, 586, 794 Buat, V., & Xu, C. 1996, A&A, 306, 61 Buat, V., et al. 2005, ApJ, 619, L51 Buat, V., et al. 2010, A&A, in press Calzetti, D., Armus, L., Bohlin, R. C., Kinney, A. L., Koornneef, J., & Storchi-Bergmann, T.

2000, ApJ, 533, 682 Calzetti, D., et al. 2005, ApJ, 633, 871 Calzetti, D., et al. 2007, ApJ, 666, 870 Dale, D. A., & Helou, G. 2002, ApJ, 576, 159 Dale, D. A., et al. 2007, ApJ, 655, 863 Desert, F.-X., Boulanger, F., & Puget, J. L. 1990, A&A, 237, 215 Draine, B. T., & Li, A. 2007, ApJ, 657, 810 Eminian, C., Kauffmann, G., Charlot, S., Wild, V., Bruzual, G., Rettura, A., & Loveday, J.

2008, MNRAS, 384, 930 Fioc, M., & Rocca-Volmerange, B. 1997, A&A, 326, 950 Förster Schreiber, N. M., Roussel, H., Sauvage, M., & Charmandaris, V. 2004, A&A, 419, 501 Giovannoli, E., Buat, V., Noll, S., Burgarella, D., & Magnelli, B. 2011, A&A, 525, A150 Gordon, K. D., Clayton, G. C., Witt, A. N., & Misselt, K. A. 2000, ApJ, 533, 236 Helou, G., et al. 2004, ApJS, 154, 253 Hirashita, H., Buat, V., & Inoue, A. K. 2003, A&A. 410, 83 17

Hopkins, A. M., et al. 2003, ApJ, 599, 971 Ishihara, D., et al. 2010, A&A, 514, A1 Kawada, M., et al. 2007, PASJ, 59, 389 Kelly, B. C. 2007, ApJ, 665, 1489 Kennicutt, R. C., Jr. 1998, ARA&A, 36, 189 Kennicutt, R. C., Jr., et al. 2007, ApJ, 671, 333 Kennicutt, R. C., et al. 2009, ApJ, 703, 1672 Kroupa, P. 2001, MNRAS, 322, 231 Leger, A., & Puget, J. L. 1984, A&A, 137, L5 Leger, A., d’Hendecourt, L., & Defourneau, D. 1989, A&A, 216, 148 Maraston, C. 2005, MNRAS, 362, 799 Maraston, C., Daddi, E., Renzini, A., Cimatti, A., Dickinson, M., Papovich, C., Pasquali, A., & Pirzkal, N. 2006, ApJ, 652, 85 Meurer, G. R., Heckman, T. M., & Calzetti, D. 1999, ApJ, 521, 64 Noll, S., Burgarella, D., Giovannoli, E., Buat, V., Marcillac, D., & Muñoz-Mateos, J. C. 2009, A&A, 507, 1793 Pérez-González, P. G., et al. 2006, ApJ, 648, 987 Relaño, M., Lisenfeld, U., Pérez-González, P. G., Vílchez, J. M., & Battaner, E. 2007, ApJ, 667, L141 Rieke, G. H., Alonso-Herrero, A., Weiner, B. J., Pérez-González, P. G., Blaylock, M., Donley, J. L., & Marcillac, D. 2009, ApJ, 692, 556 Roche, P. F., & Aitken, D. K. 1984, MNRAS, 208, 481 Rettura, A., et al. 2006, A&A, 458, 717 Saunders, W., et al. 2000, MNRAS, 317, 55 Smith, J. D. T., et al. 2007, ApJ, 656, 770 Takeuchi, T. T., Buat, V., Iglesias-Páramo, J., Boselli, A., & Burgarella, D. 2005, A&A, 432, 423 Takeuchi, T. T., Buat, V., Heinis, S., Giovannoli, E., Yuan, F.-T., Iglesias-Páramo, J., Murata, K. L., & Burgarella, D. 2010, A&A, 514, A4 Tremonti, C. A., et al. 2004, ApJ, 613, 898 Treyer, M., et al. 2010, ApJ, 719, 1191 Wu, H., et al. 2005, ApJ, 632, L79 Yamamura, I., Fukuda, Y., & Makiuti, S. 2008, AKARI/FIS all-sky Survey Bright Source Catalogue Version β-1 Release Note (Rev. 1) Yamamura, I., et al. 2009, in AKARI, a light to illuminate the misty Universe, ed. T. Onaka, G.White, T. Nakagawa, I. Yamamura, ASP Conf. Ser., 418, p.3 Zhu, Y.-N., Wu, H., Cao, C., & Li, H.-N. 2008, ApJ, 686, 155

Table 1. A brief summary of the sample. Data with an asterisk (*) are not used for SED fitting in Section 3.

Survey Band Wavelength (μm) Nb. of sources GALEX FUV, NUV 0.153, 0.231 153 SDSS u, g, r, i, z 0.355, 0.469, 0.617, 0.748, 0.893 153 2MASS J, H, Ks 1.244, 1.655, 2.169 153 IRAS* band-1, 2, 3, 4 12, 25, 60, 100 153 AKARI IRC S9W 9 126 AKARI IRC L18W 18 106 AKARI FIS N60, Wide-S, Wide-L, N160* 65, 90, 140, 160 153

Table 2. Criteria to divide the sample into three sub-samples. The length of major axis a and minor axis b of each galaxy is obtained from the SDSS image. The 40^{′′} is taken as the separating value considering the PSF size of AKARI/FIS.

Sub-sample Criteria Small a < 40^{′′} and b < 40^{′′} Medium a > 40^{′′} or b > 40^{′′} Large a > 40^{′′} and b > 40^{′′}

Table 3. Comparison between AKARI and IRAS flux. The mean values of the difference between AKARI and IRAS fluxes according to AKARI FISBSC fluxes (Catalog), fluxes derived from diffuse maps (Map) and DH model prediction (Model) are listed for each subsample of galaxies (’L’, ’M’ and ’S’ represent large, medium and small group in Table 2, respectively).

Catalog Map Model L M S L M S α = 1.375 α = 2 α = 2.625 log(f_{65}/f_{60}) -0.18 -0.09 -0.03 -0.10 -0.12 -0.01 0.00 0.03 0.04 log(f_{90}/f_{100}) -0.33 -0.27 -0.24 -0.13 -0.12 -0.11 0.05 0.00 -0.04 log(f_{140}/f_{100}) -0.09 -0.04 -0.09 0.03 0.01 -0.02 -0.30 -0.11 0.02 log(f_{160}/f_{100}) -0.20 -0.17 -0.32 0.01 0.00 0.07 -0.45 -0.20 -0.02

Table 4. SFR calculations based on Spitzer data. The luminosity is expressed in L_⊙ and SFR in M_⊙/yr.

Work SFR calculation Wu et al. (2005) logSFR = (1.09 ± 0.06)logL_8 − (10.03 ± 0.16) Zhu et al. (2008) logSFR = (0.93 ± 0.03)logL_8 − (8.59 ± 0.08) Wu et al. (2005) logSFR = (0.89 ± 0.06)logL_{24} − (7.82 ± 0.17) Calzetti et al. (2007)^* logSFR = 0.8850logL_{24} − 8.17 (1 σ uncertainty 0.03) Zhu et al. (2008) logSFR = (0.85 ± 0.01)logL_{24} − (7.47 ± 0.06) SFR = 7.8 × 10^{−10}L_{24} for 6 × 10^8 ≤ L_{24} ≤ 1.3 × 10^{10} L_⊙ Rieke et al. (2009) SFR = 7.8 × 10^{−10}L_{24} × (7.76 × 10^{−11}L_{24})^{0.048} for L_{24} > 1.3 × 10^{10} L_⊙

* For galaxies with 12 + log(O/H) > 8.35, i.e., “high metallicity” galaxies in Calzetti et al. (2007).

Table 5. Regressions between SFRs derived from AKARI 9 μm and from Spitzer 8 μm: log SFR(8 μm) = a + b log SFR(9 μm) and the mean value of the difference: < log SFR(8 μm) − log SFR(9 μm) >.

8 μm calibration a b Correlation coefficient < log SFR(8 μm) − logSFR(9 μm) > Wu et al. (2005) −0.17 ± 0.02 1.05 ± 0.03 0.968 −0.14 ± 0.18 Zhu et al. (2008) −0.20 ± 0.02 0.90 ± 0.02 0.968 −0.25 ± 0.16

Table 6. Regressions between SFRs derived from AKARI 18 μm and from Spitzer 24 μm: log SFR(24 μm) = a + b log SFR(18 μm) and the mean value of the difference: < log SFR(24 μm) − log SFR(18 μm) >.

24 μm calibration a b Correlation coefficient < logSFR(24 μm) − logSFR(18 μm) > Wu et al. (2005) −0.02 ± 0.02 1.00 ± 0.02 0.982 −0.01 ± 0.12 Calzetti et al. (2007) −0.23 ± 0.02 1.00 ± 0.02 0.982 −0.23 ± 0.12 Zhu et al. (2008) −0.02 ± 0.02 0.96 ± 0.02 0.982 −0.05 ± 0.11 Rieke et al. (2009) −0.14 ± 0.02 1.14 ± 0.02 0.982 −0.04 ± 0.17

Table 7. The MIR to 90 μm flux ratio for AGNs and normal galaxies.

Gal. log(f_9/f_{90}) log(f_{18}/f_{90}) log(f_9/f_{18}) AGN -1.69 -1.35 -0.34 Normal -1.35 -1.19 -0.16