arXiv:1012.2078v1 [astro-ph.SR] 9 Dec 2010

The Solar Neighborhood XXIII CCD Photometric Distance Estimates of SCR Targets – 77 M Dwarf Systems within 25 Parsecs

Jennifer G. Winters^1, Todd J. Henry^1, and Wei-Chun Jao^1 Department of Physics and Astronomy, Georgia State University, Atlanta, GA 30302-4106

winters@chara.gsu.edu, thenry@chara.gsu.edu, jao@chara.gsu.edu

John P. Subasavage^1 Cerro Tololo Inter-American Observatory, Casilla 603, La Serena, Chile

jsubasavage@ctio.noao.edu

Charlie T. Finch^1 United States Naval Observatory, Washington DC 20392-5420

finch@usno.navy.mil

and Nigel C. Hambly Scottish Universities Physics Alliance (SUPA), Institute of Astronomy, University of Edinburgh, Royal Observatory, Blackford Hill, Edinburgh EH9 3HJ, Scotland, UK

nch@roe.ac.uk

ABSTRACT

We present CCD photometric distance estimates of 100 SCR (SuperCOSMOS RECONS) systems with μ ≥ 0.^{′′}18/yr, 28 of which are new discoveries previously unpublished in this series of papers. These distances are estimated using a combination of new V RI photometry acquired at CTIO and JHK magnitudes extracted from 2MASS. The estimates are improvements over those determined

1Visiting Astronomer, Cerro Tololo Inter-American Observatory. CTIO is operated by AURA, Inc. under contract to the National Science Foundation.

– 2 –

using photographic plate BRI magnitudes from SuperCOSMOS plus JHK, as presented in the original discovery papers. In total, 77 of the 100 systems investigated are predicted to be within 25 pc. If all 77 systems are confirmed to have π_{trig} ≥ 40 milliarcseconds, this sample would represent a 23% increase in M dwarf systems nearer than 25 pc in the southern sky.

Subject headings: stars: distances — stars: low mass — stars: statistics — solar neighborhood — techniques: photometric

1. Introduction

For more than a century, there has been serious effort invested in compiling a complete survey of stars near the Sun. Recent work of note includes Lépine’s SUPERBLINK program that has detected dwarfs, giants, and subgiants in the northern sky with spectroscopic distances ≤ 25.0 pc (Lépine 2005b) and additional objects in the south, but without spectral types or distance estimates (Lépine 2005a; Lépine 2008). Reid and collaborators have also made progress in this area, focusing on objects within 20 pc using spectrophotometry, as reported in the Meeting the Cool Neighbors papers (Reid et al. 2008 and references therein). These efforts include both previously known and new members of the solar neighborhood. The survey most similar to our survey discussed here is that of Deacon who used SuperCOS- MOS I plates and 2MASS to reveal new nearby red objects in the southern sky (Deacon et al. 2005, 2007). This paper focuses specifically on new discoveries from our SuperCOSMOS RECONS (SCR) effort (Hambly et al. 2004, Henry et al. 2004, Subasavage et al. 2005a, Subasavage et al. 2005b, Finch et al. 2007).

The most widespread method of revealing new members in the Sun’s vicinity is through proper motion searches, as nearby objects generally have larger proper motions than those further away. Much of the nearby star work in the latter half of the twentieth century is based upon the Palomar and UK Schmidt sky surveys done by Luyten (Luyten 1979a, 1979b) and the Lowell proper motion surveys by Giclas (Giclas et al. 1971; Giclas et al. 1978a, 1978b). Long-term efforts to obtain optical photometry by Weis (Weis 1996) in the northern hemisphere and Eggen (Eggen 1987) in the southern hemisphere were carried out by observing one star at a time. This photometry is often used to estimate distances to stars using various color-absolute magnitude calibrations. Much of these data were then incorporated into the Catalog of Nearby Stars (CNS, Gliese and Jahreiß 1991), which provided a snapshot view of the solar neighborhood population, albeit one that was incomplete. NStars continued in this vein with a comprehensive database of objects with trigonometric parallaxes (see Henry et al. 2002 and Henry et al. 2003 for more complete discussions.). As we entered the

– 3 –

twenty-first century, large sky surveys such as 2MASS (Skrutskie et al. 2006), DENIS (The Denis Consortium 2005), and SDSS (Adelman-McCarthy et al. 2009) gathered magnitudes in optical and infrared filters of huge numbers of sources that could be examined for nearby star candidates.

Once a new nearby star candidate is found, distances can be determined using a variety of astrometric, photometric, and spectrophotometric techniques. In this paper, we focus on distance estimates made using photometry from a combination of optical CCDs and infrared arrays, which is an effective intermediate method for refining membership of the solar neighborhood. This method provides distances that are more accurate than those determined using photographic plates, but that are not as precise (or as time and labor intensive) as those calculated via trigonometric parallax.

A primary goal of the RECONS group (the Research Consortium on Nearby Stars^1) is to identify hidden members of the solar neighborhood within 25 pc to match the horizons of the CNS and NStars efforts. We have focused our searches in the southern hemisphere because that portion of the sky has been historically underrepresented and is expected to yield rich treasures in the form of new stellar neighbors. In this paper, we first discuss recent photometric distance efforts by others (§2), then provide descriptions of our two methods used to estimate distances photometrically: via scanned photographic plates (§3) and improvements based on CCD photometry (§4), with complementary spectroscopy (§5). We sum up the results in §6.

2. Recent Photometric Distance Efforts by Others

Table 1 lists the main photometric distance estimation efforts in the southern sky since the NStars Database was compiled. The efforts considered are purely photometric and are independent of any spectral types or relations based on spectroscopy. The criteria for inclusion in the counts are that the systems (1) be new discoveries, (2) have colors of red dwarfs (effectively spectral type M, (V − K) ≳ 3.0), (3) be found in the southern hemisphere (DEC ≤ 0^∘), and (4) are estimated to be within 25.0 pc via a photometric distance estimate.

We used the NStars Database as a benchmark to evaluate solar neighborhood completeness, as NStars incorporated only those objects for which a parallax had been measured; therefore, it was the most definitive collection of systems found within 25 pc. Great care was taken when extracting the sample of 329 southern M dwarf systems from NStars. All

1www.recons.org

– 4 –

northern hemisphere objects, as well as those objects brighter than M_V = 9.00, the adopted cutoff for the brightest M dwarfs, were eliminated. For the remaining objects with no designated spectral type, various colors such as (V − I), (V − J), and (J − K), depending on the availability of photometry, were used to eliminate white dwarfs that remained in the sample. If the primary component of a multiple system was discovered to be anything other than an M dwarf, or if the system contained a white dwarf, the system was omitted. Finally, the individual components of multiple systems were combined to give a count of southern M dwarf systems.

Figure 1 shows results from these photometric distance efforts in concert with the 329 systems from NStars (small dots). Declination is plotted against Right Ascension in a polar plot with RA progressing counterclockwise from 0 to 24 hours and DEC starting at 0^∘ at the outer boundary and moving inward to −90^∘ at the center. Phan-Bao’s 37 objects^2 are denoted by open triangles, Reylé’s 34 objects^3 are denoted by open circles, Finch’s 15 objects^4 are noted by upside-down open triangles, and Costa & Méndez’s three objects^5 are indicated with open squares. The 77 systems found to date in SCR surveys (discussed in the next section) are represented by solid stars. In all cases, the counts and points in Figure 1 represent newly discovered southern systems.

3. Definition of the SCR Sample

SCR objects are previously undiscovered systems that have been revealed through searches utilizing the digitally scanned SuperCOSMOS photographic plates. A sample of 72 star systems was harvested from five earlier papers in this series (Hambly et al. 2004, Henry et al. 2004, Subasavage et al. 2005a, Subasavage et al. 2005b, Finch et al. 2007). To date, an additional 28 systems have been found during continuing searches and are reported

2In the case of Phan-Bao et al. 2001, where two different distances were given, we used the Dist_I that they considered more dependable. Their photometric distances were estimated using DENIS I − J colors with errors ∼15-45%.

3In the case of Reylé et al., we used only those distance estimates that were unambiguously within 25.0 pc, i.e., we do not count those stars with multiple estimates in Reylé et al. 2002. Their photometric distances were estimated using DENIS I − J colors with errors up to 45%.

4Finch’s photometric distances are based on SuperCOSMOS BRI and 2MASS JHK photometry and were estimated using a method identical to that discussed in this paper for plate photometry estimates.

5The photometric distances were estimated using M_V vs. V − R and M_V vs. V − I relations derived in Henry et al. 2004, with errors ∼15%.

– 5 –

here for the first time. Table 2 lists the names, coordinates, and SuperCOSMOS B_J , R_{59F} , and I_{IV N} plate magnitudes. Additional data for these objects are found in Table 3.

The 100 SCR systems (104 objects) listed in Table 3 comprise all SCR red dwarfs with proper motions ≥ 0.^{′′}18/yr estimated to be within 25.0 pc based upon “plate distance estimates.” These estimates use SuperCOSMOS B_J , R_{59F} , and I_{IV N} plate magnitudes (hereafter BRI) and JHK_s^6 magnitudes from 2MASS. The 100 systems all have M dwarf primaries, two of which are binaries with separations large enough to permit separate plate distance estimates for the secondaries, SCR 2241-6119B and SCR 2335-6433B. Two additional objects, SCR1107-3420B and SCR1746-8211, have CCD distance estimates that place them within 25.0 pc, but they are not included in the counts of M dwarf discoveries because the primary of the system is not an M dwarf.

In Table 3 columns 1–3 are the names, RA, and Dec (epoch and equinox 2000.0). Columns 4 and 5 are the proper motions and position angles as measured by SuperCOSMOS. Columns 6–9 list the V RI magnitudes and the number of nights each system was observed. The 2MASS JHK magnitudes are listed in columns 10–12. Columns 13–18 provide the plate distance estimates, related errors, and number of color-absolute magnitude relations utilized (see next paragraph), followed by the CCD distance estimates (see §4.3), the corresponding errors, and number of relations utilized. The tangential velocities, based on the CCD distance estimates and the SuperCOSMOS proper motions, are given in column 19. Column 20 lists the spectral types, where available, and column 21 includes the references for the publications that originally reported each object, where the 29 new objects in this paper are noted with reference 6. A final column (22) is provided for notes.

A system’s plate distance estimate determines its membership in this sample and is based on up to 11 useful M_K vs. color relations, as described in Hambly et al. (2004). Relevant errors in the SuperCOSMOS plate photometry for this sample, based on the ranges in BRI magnitudes for the sources, are 0.2−0.6 mag for B = 11−21, 0.1−0.3 mag for R = 9−18, and 0.2−0.4 mag for I = 8−16 (Hambly et al. 2001). The errors on the individual passbands are largely systematic in origin and are correlated between the passbands because of the calibration technique used; however, the errors on colors like (B − R) and (R − I) are smaller, which is more important for their use in distance-color relations (see also §4.4).

A plate distance estimate is considered reliable if all 11 relations are applicable, i.e. if a star’s color falls within the range covered by the calibrations detailed in Hambly et al. (2004) for single, main sequence stars. Between six and ten relations indicates that the distance estimate is indicative, but less reliable. Six relations are adopted because if one plate magni-

6Henceforth, the subscript on the 2MASS K_s filter will be dropped.

– 6 –

tude is erroneous, up to five relations may drop out. Thus, if at least six relations are valid, then at least two of the three BRI magnitudes provide optical/infrared colors consistent with normal main sequence stars. In the present sample, only two stars have fewer than six valid relations, so their distance estimates are highly suspect. In fact, the improved distance estimates discussed next indicate that both are beyond 50 pc.

4. Improving the Distance Estimates

4.1. V RI CCD Photometry

Our goal was to obtain at least two sets of V_J , R_{KC} and I_{KC}^7 (hereafter V RI) photometry for all 104 objects to improve our distance estimates. These new distance estimates are dubbed “CCD distance estimates” to reflect the combination of CCD photometry at V RI and 2MASS photometry at JHK, and all R and I magnitudes refer to CCD values for the remainder of this paper.

Care is taken during a night of photometry to ensure that previously observed objects are sandwiched between targets that are new to the program. Multiple results for a single object are then compared to ensure consistency and can also be used to indicate possible variability. The photometric observations used in making the distance estimates reported here span a seven year interval from 2003 January through 2010 May.^8 In total, over 800 frames were acquired on the 0.9m telescope at the Cerro Tololo Inter-American Observatory (CTIO) for this study. A small subset of sixteen frames was acquired on the CTIO 1.0m in 2005 August; results are consistent to 0.03 mag with the 0.9m data.

All data were reduced using IRAF. Calibration frames taken at the beginning of each night were used for typical bias subtraction and dome flat-fielding. Standard star fields from Graham (1982), Bessel (1990) and/or Landolt (1992, 2007) were observed multiple times each night in order to derive transformation equations and extinction curves. In order to match those used by Landolt, apertures 14^{′′} in diameter were used to determine the stellar fluxes, except in cases where close contaminating sources needed to be deconvolved. In these

7Subscript: J = Johnson, KC = Kron-Cousins. The central wavelengths for V_J , R_{KC} and I_{KC} are 5475Å, 6425Å and 8075Å, respectively.

8On the CTIO 0.9m, the Tek #2 V RI filter set was used; however, the Tek #2 V filter originally used cracked in March 2005 and was replaced by the very similar Tek #1 V filter. Reductions indicate no significant differences in the photometric results from the two filters, as discussed in detail in Jao et al. 2010. On the CTIO 1.0m, the Y4KCam filter set was used that contains the same filters as those on the 0.9m.

– 7 –

cases, smaller apertures were used, and aperture corrections were applied. Further details about the data reduction procedures, transformation equations, etc., can be found in Jao et al. (2005).

Figures 2−4 illustrate the total errors vs. magnitude in each of the three filters for the 268 stars with three or more nights of photometry from our program, including some of the SCR stars reported here. These errors incorporate signal-to-noise errors, nightly errors determined by fits to standard stars, and night-to-night measurement differences to provide a comprehensive assessment of our photometric errors. Signal-to-noise errors are 0.05 mag or less for objects brighter than 16^{th} mag at V , brighter than 18^{th} mag at R, and brighter than 17^{th} mag at I. Standard star fits on most nights have errors of 0.01−0.02 mag. Typical variations in photometric measurements from night to night are 0.02−0.03 mag. As can be seen in Figures 2−4, the convolution of all three errors typically results in total errors of 0.03 mag or less for 66% of objects at V and 84% of objects at both R and I, as evident from the inset histograms. Note that the lack of a general increase in errors for fainter stars is caused by observers increasing integration times to provide adequate signal-to-noise on even the faintest targets. Nonetheless, these red dwarfs are faintest at V , so the resulting errors are somewhat larger than at R and I. At V , 94% of the objects presented have total errors of 0.06 mag or less; for R and I, this statistic is 99%. The SCR systems reported here follow the general trend reported above: the fraction of objects with errors less than 0.03 mag are 73%, 94% and 92%, respectively, at V RI. At V , 94% of the objects have total errors less than 0.06 mag, while this is true of 100% of the objects at R and I.

4.2. JHK Photometry from 2MASS

Infrared photometry in the JHK_s system has been extracted from 2MASS and is rounded to the nearest hundredth mag. The same 2MASS photometry has been used for both the plate distance estimates and new CCD distance estimates presented here. The JHK_s magnitude errors listed are the x_−sigcom errors (where x is j, h, or k) and include target, global, and systematic influences. These errors are generally less than 0.04 mag. Exceptions at H are SCR0214-0733 (0.05 mag), SCR0211-6108, SCR1230-3411, and SCR0717-0500 (all 0.06 mag).

– 8 –

4.3. CCD Distance Estimates

The CCD distance estimates^9, as described in Henry et al. (2004), are found using a method similar to that used for the photographic plate distance estimates. The difference is that we use the accurate V RI magnitudes obtained at CTIO instead of BRI plate magnitudes from SuperCOSMOS. The maximum number of relations possible from the combination of V RIJHK magnitudes is 15 (the same number of combinations as for the plate relations), but only 12 yield useful results. The color spread is not large enough in three of the relations (M_K vs. J − H, J − K, and H − K) to give reliable results and so are omitted.

Of the 100 systems with photographic plate distance estimates that place them closer than 25.0 parsecs, we find 77 to have CCD distance estimates within the 25.0 pc horizon. Thus, we retain 77% of the SuperCOSMOS discoveries as likely nearby stars. All systems with CCD distance estimates within 15.0 pc and additional compelling systems are targeted for trigonometric parallax measurements as part of our Cerro Tololo Inter-American Observatory Parallax Investigation (CTIOPI) (Jao et al. 2005, Henry et al. 2006, Subasavage et al. 2009, Riedel et al. 2010). At present, 31 of the systems discussed here are on the CTIOPI program.

Figure 5 shows a comparison of the two photometric distance estimates with error bars omitted for clarity. Primary stars and a few secondaries for which separate photometry is available are plotted. The single point in the upper right of the plot and one point with a plate distance estimate of 25–30 pc are secondary components (SCR2241-6119B and SCR2335-6433B). Twenty-three systems are estimated to be beyond 25 pc using CCD distance estimates. The two most likely causes of the distance offsets are poor plate photometry compared to CCD photometry and close multiples that are unresolved on the plates but resolved in CCD images. Errors in the plate photometry certainly cause most of the discrepancies. A distance of up to ∼35 pc is possible if the object is an unresolved binary in which the two components are identical and contribute an equal amount of light to the measured magnitude. All SCR targets have been inspected for duplicity in the CCD images. Seven were found to be binaries with separations between 1^{′′} (typical resolution of our CCD images) and 5^{′′}. The typical resolution of the plate images for binaries with magnitude differences of ≲ 2 is 4^{′′}. Details on multiple systems can be found in §5.1.

Eight objects are found to have CCD distance estimates of 35−65 pc. One object (SCR2335-6433B in the upper right of Figures 5 and 6) is a common proper motion com-

9The term ’CCD distance estimate’ is used for the remainder of the paper to indicate a CCD photometric distance estimate.

– 9 –

panion that was discovered by eye when blinking plates. The remaining seven objects had 3−8 plate relations contributing to their distance estimates rather than the full suite of 11, indicative of inaccurate estimates. The corresponding CCD distances for these objects often rely on 6−10 relations rather than the full suite of 12, typically because they are bluer than some of the plate and CCD distance relations. Three of the eight objects have already been verified to be K dwarfs via spectroscopy.

4.4. Photometric Distance Estimate Errors

When using both the plate and CCD distance estimating suites, there is inherent spread around the fit line for each relation that is a result of two causes: (1) the deviations due to errors in parallax and photometry for the stars used to derive the fits, and (2) cosmic scatter due to differences in stellar ages, compositions, and perhaps magnetic properties. Cosmic scatter dominates the offsets between distance estimates and true distances. Unresolved, unknown multiples may also contribute, although great care was taken to remove such systems before the fits were made, so this is not a significant issue. In order to estimate the reliability of the suites of relations in both the plate and CCD methods, we have run single, main sequence, red dwarfs with known trigonometric distances back through the relations to derive representative errors. The median offsets between the trigonometric and photometric distance estimate are 26% for the plate suite and 15% for the CCD suite.

For all errors on distance estimates listed in Table 3, these percentage errors are combined in quadrature with each star’s individual error, which comes from the up to 11 or 12 distances derived from the plate and CCD suites, respectively. Figure 6 is the same as Figure 5, but with the total errors shown for both estimates. Note that in no case can the plate distance estimate have an error less than 26% nor less than 15% for CCD distance estimate.

Figure 7 illustrates a comparison of the SuperCOSMOS plate (R − I) color and the CCD (R − I) color for 100 SCR stars reported here. The fit is a polynomial described by

(R − I)_{ccd} = 0.640 + 0.192*(R − I)_{plate} + 0.198*(R − I)^2_{plate} - 0.035*(R − I)^3_{plate}.

This polynomial permits users of SuperCOSMOS data to predict the (R − I)_{ccd} color that would be measured for red objects, i.e. those with −0.2 = (R − I)_{plate} = 3.8.

Two outlying points represented by open squares are SCR1448-5735 and SCR1637-4703, both of which were omitted from the fit because they are blended with other sources in R images. Two other objects for which I plate magnitudes were not available (SCR1931-0306 and SCR2230-5244), were also excluded from the fit. The mean absolute deviation is 0.27

– 10 –

mags, indicating that the SuperCOSMOS (R − I) color is roughly nine times less accurate than the CCD (R − I) color, which typically has errors less than 0.03 mag.

5. Confirmation as Red Dwarfs: Spectroscopy and the Color-Color Diagram

For 37 stars, we have spectra that were acquired on the CTIO 1.5m between 2003 July and 2006 December. Observations were made using a 2.^{′′}0 slit or wider in the RC Spectrograph with grating #32 and order blocking filter OG570 to provide wavelength coverage from 6000 to 9500 Å and resolution of 8.6 Å on the Loral 1200x800 CCD. Reductions were done using standard procedures via IRAF. Spectral types have been assigned on the RECONS system (Jao et al. 2008). Thirty-four of the stars are confirmed to be M dwarfs, while three are K dwarfs. The three K dwarfs have slipped into the sample because of erroneous plate magnitudes, as evidenced by having fewer than 11 relations for their plate distance estimates.

For all of the stars, we use a color-color diagram to verify that the sample objects are red dwarfs. Figure 8 is a color-color diagram that plots (V − K) versus (J − K). Labels denoting spectral types are shown inside the left axis. SCR stars are open circles, with the combined photometry of seven SCR close binaries marked by crosses inside the circles. The dots are RECONS 10 pc sample members (Henry et al. 2006), and a few known giants are plotted as solid triangles for reference. As is evident from this diagram, none of the SCR stars presented in this paper fall in the region where known giants are found, so we are relatively confident that none of these objects are giants. We anticipate that these objects are not subdwarfs because their tangential velocities are ≤ 100 km/s. The point that is slightly elevated (1.02, 5.90) toward the three giants is the binary system SCR1630-3633AB.

5.1. Multiples

Eleven of the systems presented in this paper are binary, with seven systems having separations less than 3^{′′}. Six of these close binaries are newly discovered via the SCR effort — SCR0630-7643AB, SCR0644-4223AB, SCR1630-3633AB, SCR1856-4704AB, SCR1926- 8216AB, and SCR2042-5737AB — while SCR1845-6357A was discovered via the SCR effort and the companion first detected by Biller et al. (2006). Table 4 lists the binary data, including the separations of the components, position angles of the secondaries relative to the primaries, distance estimates of the system for close systems (indicated by brackets) and of the components where separate photometry was possible, and the distance errors.

All systems were re-blinked using the SuperCOSMOS photographic plates to ensure

– 11 –

that no widely separated companions out to 5^′ had been previously overlooked. No new discoveries were made. A search was then made for closer companions by examining all I frames taken at CTIO in IRAF, using the surface, contour and radial plot features available. Separations were determined using the SExtractor (Bertin & Arnouts 1996) feature in IRAF, with some parameters (detect minarea, deblend nthresh, deblend mincont) modified in order for the program to recognize both components of the close system. These results are listed in Table 4.

Two binary systems, SCR0630-7643AB and SCR1630-3633AB, have been confirmed to be physically related via HST-FGS (Hubble Space Telescope Fine Guidance Sensors) observations. The ΔV values between the two components in each system were estimated by comparing HST-FGS scans to systems in which the ΔV is known (Henry et al. 1999).

5.2. Objects Worthy of Note

SCR0630-7643AB has a photometric distance estimate of 5.5 pc, but has a trigonometric distance of 8.8 pc in Henry et al. 2006. This is a new close binary with a separation of 1.^{′′}0 and a ΔV ∼ 0.3 mag that has been confirmed with both continuing optical speckle and HST-FGS observations.

SCR1107-3420B is 30.^{′′}6 from the primary at a position angle of 107.1^∘; the primary component is a white dwarf with an estimated distance of 28.2 pc (Subasavage et al. 2007). No companions have been found for the red dwarf secondary by HST-FGS and speckle observations.

SCR1630-3633AB is a new binary system, confirmed by HST-FGS with ΔV ∼ 0.7 mag. A more realistic distance estimate is ∼20 pc, taking into consideration the system’s multiplicity.

SCR1746-8211 was thought to be a possible common proper motion companion to HD 158866, at a separation of 76.^{′′}5 at 290.8^∘ (Finch et al. 2007). However, the distance estimate, 15.5 pc, is not in agreement with the distance of the primary, 30.6 pc, as measured by HIPPARCOS (van Leeuwen 2007). The proper motion of the primary, μ = 0.^{′′}211/yr at 191^∘, is inconsistent with that of the secondary, μ = 0.^{′′}288/yr at 184.9^∘. Thus, the two objects do not appear to be in the same system.

SCR1845-6357AB has a CCD distance estimate of 4.6 pc and a trigonometric parallax that revises the distance to 3.9 pc (Henry et al. 2006). This is the 24^{th} closest system to the Sun, composed of M8.5 and T dwarfs at a separation of 1.^{′′}2 (Biller et al. 2006).

– 12 –

SCR2241-6119AB is a binary system separated by 9.6^{′′} at 211.2^∘. The two components appear to be co-moving in SuperCOSMOS images, but the proper motion values do not match: A has μ = 0.^{′′}184/yr at 124.0^∘ while B has μ = 0.^{′′}287/yr at 108.0^∘. However, the B component is very faint in the B image, faint in the R image, and not round in I image, likely leading to a poor, and inconsistent, proper motion measurement.

SCR2335-6433AB has a separation of 22.^{′′}4 at 25.9^∘ (Finch et al. 2007), making photometry for each component possible. However, the distance estimates for the A and B components, 35.9 and 56.7 pc, respectively, do not agree. This is likely due to the fact that only nine of the 12 CCD relations were in agreement for the primary. As all 12 relations were utilized in the distance estimate of the secondary, the true distance of the system is probably closer to that of the secondary.

6. Discussion

The majority of the objects (71 of 104, or 68% of the sample) have V >14 because these new discoveries are fainter than those targeted by Luyten in most of the southern sky. Only the faint companion object discovered by eye during the blinking process, SCR2241-6119B (R = 17.23), is fainter than CCD R = 16, a consequence of the plate R = 16.5 cut-off chosen in our searches to date. The color-color diagram in Figure 8 shows that most of the 104 SCR objects are M3−M6 type dwarfs, which corresponds to the “sweet spot” created by our search magnitudes through most of the 25 pc volume.

As can be seen in the polar plot of Figure 1, many of these SCR discoveries are south of −60^∘. Luyten’s Palomar survey for proper motion stars extended to −45^∘ for a quarter of the southern sky and to −33^∘ for the entire southern sky (Luyten 1974), and his Bruce Survey covered the remainder of the southern sky. Giclas searched declinations north of −45^∘ for stars of magnitudes 8−17 with proper motions ≥ 0.20 and at even smaller μ for red objects (Giclas et al. 1978a). Still, we have found 11 systems between DEC = 0^∘ and −30^∘, an area of the sky covered previously by both Luyten and Giclas. Four of these eleven are brighter than V =14 and so were missed by those surveys.

In total, the 77 systems we determine to be within 25 pc, when compared to the 329 southern systems found in NStars, result in a 23% increase in the number of red dwarf systems nearer than 25.0 pc in the southern sky. In Table 5 we summarize the distance distribution for the 100 systems discussed in this paper, as well as the number of binaries found within each distance bin. We anticipate that seven will prove to be within 10 pc and 70 will be between 10 and 25 pc, while the remaining 23 systems are likely beyond 25

– 13 –

pc. If all of the new red dwarf systems from our SCR search to date, plus the 89 systems found by Phan-Bao et al. , Reylé et al., Finch et al.,and Costa & Méndez are found to have trigonometric parallaxes placing them within 25 pc, the number of red dwarfs systems in the southern sky within that horizon would increase by 50%. Forthcoming in this series is a paper presenting trigonometric parallaxes for roughly one-third of the SCR systems in this paper, three of which (SCR0630-7643AB, SCR1138-7721, SCR1845-6357AB) have had results previously published (Henry et al. 2006).

We have several continuing efforts to reveal the Sun’s red dwarf neighbors. We have found another ∼100 systems with 0.^{′′}40/yr > μ ≥ 0.^{′′}18/yr between DEC = 0^∘ and −47^∘ during our continuing sweep of the southern sky. This search is a complement to our Finch et al. 2007 effort and will complete the SCR search of the southern sky for stars that would have been members of Luyten’s New Luyten Two-Tenths (NLTT) Catalogue (Luyten 1979b). Already underway is a project to gather photometric data for ∼150 additional SCR systems that have photographic plate distance estimates placing them between 25 and 30 parsecs. Some of these systems will, in effect, replace the 23 systems with CCD distances beyond the 25 pc original limit of the plate distances. Already, of the thirty-eight systems for which we have obtained initial V RI photometry, nine are anticipated to be nearer than the 25 pc horizon. Still remaining are additional searches that probe beyond the R = 16.5 cutoff of our first sweep of the southern sky.

7. Acknowledgments

The support of additional RECONS team members was vital for this research, in particular Adric Riedel. We also thank Brian Mason for insight on preliminary optical speckle survey results, as well as Ed Nelan for early results from HST-FGS. This work has been supported under National Science Foundation grants AST 05-07711 and AST 09-08402, as well as by NASA’s Space Interferometry Mission, and Georgia State University. We also thank the members of the SMARTS Consortium, who enable the operations of the small telescopes at CTIO, as well as the observer support at CTIO, especially Edgardo Cosgrove, Arturo Gomez, Alberto Miranda, and Joselino Vasquez. This research makes use of data products from the Two Micron All Sky Survey, which is a joint project of the University of Massachusetts and the Infrared Processing and Analysis Center/California Institute of Technology, funded by the National Aeronautics and Space Administration and the National Science Foundation. This research also makes use of the SIMBAD database and the Aladin and Vizier interfaces, operated at CDS, Strasbourg, France. Thank you to the referee for their helpful comments, as well.

– 14 –

REFERENCES Adelman-McCarthy, J. K., & et al. 2009, VizieR Online Data Catalog, 2294, 0 Bertin, E., & Arnouts, S. 1996, A&AS, 117, 393 Bessel, M. S. 1990, A&AS, 83, 357 Biller, B. A., Kasper, M., Close, L. M., Brandner, W., & Kellner, S. 2006, ApJ, 641, L141 Costa, E., & Méndez, R. A. 2003, A&A, 402, 541 Deacon, N. R., Hambly, N. C., & Cooke, J. A. 2005, A&A, 435, 363 Deacon, N. R., & Hambly, N. C. 2007, A&A, 468, 163 Delfosse, X., et al. 2001, A&A, 366, L13 The Denis Consortium 2005, VizieR Online Data Catalog, 1, 2002 Eggen, O. J. 1987, AJ, 93, 379 Finch, C. T., Henry, T. J., Subasavage, J. P., Jao, W.-C., & Hambly, N. C. 2007, AJ, 133, 2898 Finch, C. T., Zacharias, N., & Henry, T. J. 2010, arXiv:1007.3186 Giclas, H. L., Burnham, R., & Thomas, N. G. 1971, Flagstaff, Arizona: Lowell Observatory, 1971, Giclas, H. L., Burnham, R., Jr., & Thomas, N. G. 1978, Lowell Observatory Bulletin, 8, 51 Giclas, H. L., Burnham, R., Jr., & Thomas, N. G. 1978, Lowell Observatory Bulletin, 8, 89 Gliese, W., & Jahreiß, H. 1991, On: The Astronomical Data Center CD-ROM: Selected Astronomical Catalogs, Vol. I; L.E. Brotzmann, S.E. Gesser (eds.), NASA/Astronomical Data Center, Goddard Space Flight Center, Greenbelt, MD, Graham, J. A. 1982, PASP, 94, 244 Hambly, N. C., Henry, T. J., Subasavage, J. P., Brown, M. A., & Jao, W.-C. 2004, AJ, 128, 437 Hambly, N. C., Irwin, M. J., & MacGillivray, H. T. 2001, MNRAS, 326, 1295

– 15 –

Henry, T. J., Backman, D. E., Blackwell, J., Okimura, T., & Jue, S. 2003, Astrophysics and Space Science Library, 289, 111 Henry, T. J., Franz, O. G., Wasserman, L. H., Benedict, G. F., Shelus, P. J., Ianna, P. A., Kirkpatrick, J. D., & McCarthy, D. W., Jr. 1999, ApJ, 512, 864 Henry, T. J., Jao, W.-C., Subasavage, J. P., Beaulieu, T. D., Ianna, P. A., Costa, E., & Méndez, R. A. 2006, AJ, 132, 2360 Henry, T. J., Subasavage, J. P., Brown, M. A., Beaulieu, T. D., Jao, W.-C., & Hambly, N. C.

2004, AJ, 128, 2460 Henry, T. J., Walkowicz, L. M., Barto, T. C., & Golimowski, D. A. 2002, AJ, 123, 2002 Jao, W.-C., Henry, T. J., Beaulieu, T. D., & Subasavage, J. P. 2008, AJ, 136, 840 Jao, W.-C., Henry, T. J., Subasavage, J. P., Brown, M. A., Ianna, P. A., Bartlett, J. L., Costa, E., & Méndez, R. A. 2005, AJ, 129, 1954 Jao, W.-C. et al., 2010, submitted to AJ Landolt, A. U. 1992, AJ, 104, 372 Landolt, A. U. 2007, AJ, 133, 2502 Lépine, S. 2005, AJ, 130, 1247 Lépine, S. 2005, AJ, 130, 1680 Lépine, S. 2008, AJ, 135, 2177 Luyten, W. J. 1974, IAU Symp. 61: New Problems in Astrometry, 61, 169 Luyten, W. J. 1979, LHS Catalogue. Second edition., by Luyten, W. J.. Publ. by Univ. Minnesota, Minneapolis, USA., 100 p., Luyten, W. J. 1979, NLTT catalogue. Volume I. +90 to +30 . Volume. II. +30 to 0 ., by Luyten, W. J.. Publ. by Univ. Minnesota, Minneapolis, USA. Vol. I: 282 p., Vol. II: 286 p., Phan-Bao, N., et al. 2001, A&A, 380, 590 Phan-Bao, N., et al. 2003, A&A, 401, 959 Phan-Bao, N., Forveille, T., Martín, E. L., & Delfosse, X. 2006, ApJ, 645, L153

– 16 –

Phan-Bao, N., et al. 2008, MNRAS, 383, 831 Reid, I. N., Cruz, K. L., Kirkpatrick, J. D., Allen, P. R., Mungall, F., Liebert, J., Lowrance, P., & Sweet, A. 2008, AJ, 136, 1290 Reylé, C., & Robin, A. C. 2004, A&A, 421, 643 Reylé, C., Robin, A. C., Scholz, R.-D., & Irwin, M. 2002, A&A, 390, 491 Riedel, A. R., et al. 2010, AJ, 140, 897 Skrutskie, M. F., et al. 2006, AJ, 131, 1163 Subasavage, J. P., Henry, T. J., Bergeron, P., Dufour, P., Hambly, N. C., & Beaulieu, T. D.

2007, AJ, 134, 252 Subasavage, J. P., Henry, T. J., Hambly, N. C., Brown, M. A., & Jao, W.-C. 2005, AJ, 129, 413 Subasavage, J. P., Henry, T. J., Hambly, N. C., Brown, M. A., Jao, W.-C., & Finch, C. T.

2005, AJ, 130, 1658 Subasavage, J. P., Jao, W.-C., Henry, T. J., Bergeron, P., Dufour, P., Ianna, P. A., Costa, E., & Méndez, R. A. 2009, AJ, 137, 4547 van Leeuwen, F. 2007, Astrophysics and Space Science Library, 350, Weis, E. W. 1996, AJ, 112, 2300

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 17 –

Fig. 1.— Polar plot for southern hemisphere photometric distance estimates of objects within 25.0 pc, where RA advances counterclockwise from zero to 24 hours, and DEC ranges from 0^∘ at the outer edge to −90^∘ in the center. The 329 red dwarf primaries with trigonometric parallaxes from NStars are noted as small solid black dots; Phan-Bao et al. results are shown as 37 open triangles; Reylé et al. results are shown as 34 open circles; Finch et al. results are 15 open upside-down triangles; Costa & Méndez results are 3 open squares; RECONS’ SCR results are shown as 77 solid stars from this paper with CCD photometric distance estimates.

– 18 –

Fig. 2.— Total CCD photometric errors vs. V magnitude for the CTIO 0.9m telescope data. Inset at the upper left is a histogram of the number of objects in each error bin. The total number of objects plotted is 268 (including some of the SCR objects presented in this paper), and each error bin is 0.01 mag. The arrow at the upper right of the figure indicates that LEHPM1-3396 (V=19.38) and LHS 2021 (V=19.21) are both off the plot.

– 19 –

Fig. 3.— Same as Figure 2, but for CCD photometry in the R band.

– 20 –

Fig. 4.— Same as Figure 2, but for CCD photometry in the I band.

– 21 –

Fig. 5.— CCD distance vs. plate distance without error bars. A solid diagonal line represents CCD distance estimates exactly matching photographic plate distance estimates. The dashed line is a 25.0 pc boundary, indicating the ultimate distance horizon of interest for this sample. Outliers have been labeled.

– 22 –

Fig. 6.— CCD distance vs. plate distance with error bars. The total errors for photographic plate distance estimates include the standard deviation of the (up to) 11 individual distance estimates plus 26% systematic errors incorporated primarily because of cosmic scatter. Similarly, the total errors for CCD distance estimates include the standard deviation of the (up to) 12 individual distance estimates plus 15% systematic errors incorporated primarily because of cosmic scatter.

– 23 –

Fig. 7.— CCD (R − I) color vs. Plate (R − I) color with a polynomial fit for 100 SCR objects. The two outliers, denoted by open squares and labeled, were not used in the fit due to blending on the R plates, nor were two objects for which no I plate magnitude was available (SCR1931-0306 and SCR2230-5244).

– 24 –

Fig. 8.— Color-color diagram of (V − K) versus (J − K). Spectral type estimates are listed inside the y-axis. Open circles indicate 104 SCR objects presented in this paper; for the two resolved binary systems (SCR2241-6119AB and SCR2335-6433AB), photometry is available for both components. X’s surrounded by open circles symbolize confirmed SCR binaries with combined photometry. Known RECONS 10 pc sample systems are shown as solid dots, and known giants are denoted by solid triangles.

– 25 –

Table 1. Recent Photometric Distance Estimation Efforts in the Southern Sky

Source # Systems Reference

NStars 329^a 1,2 Phan-Bao et al. 37 3,4,5,6,7 Reylé et al. 34 8,9 Finch et al. 15 10 Costa & Méndez 3 11 RECONS (plate phot) 100 12,13,14,15,16,* RECONS (CCD phot) 77 *

atrigonometric parallaxes ≥ 40 milliarcseconds

Note. — (1): NStars Database, see Henry et al. 2002; (2): NStars Database, see Henry et al. 2003; (3): Delfosse et al. 2001; (4): Phan-Bao et al. 2001; (5): Phan-Bao et al. 2003; (6): Phan-Bao et al. 2006; (7): Phan-Bao et al. 2008; (8): Reylé et al. 2002; (9): Reylé & Robin(2004); (10): Finch et al. 2010; (11): Costa & Méndez 2003; (12): Hambly et al. 2004; (13): Henry et al. 2004; (14): Subasavage et al. 2005a; (15): Subasavage et al. 2005b; (16): Finch et al. 2007; (*): this paper.

– 26 –

Table 2. BRI Photometric Results for New SCR Discoveries

Name R.A. DEC B_J R_{59F} I_{IV N}

SCR0017-3219 00 17 15.73 −32 19 54.0 16.80 14.59 12.48 SCR0027-0806 00 27 45.36 −08 06 04.7 18.65 16.26 13.49 SCR0113-7603 01 13 31.47 −76 03 09.3 17.68 15.23 13.05 SCR0137-4148 01 37 23.49 −41 48 56.2 16.91 14.55 12.24 SCR0150-3741 01 50 13.25 −37 41 52.0 15.80 13.49 11.41 SCR0214-0733 02 14 44.69 −07 33 24.7 ..... 9.71 8.82 SCR0325-0308 03 25 03.09 −03 08 20.4 15.22 13.17 11.39 SCR0506-4712 05 06 07.29 −47 12 51.6 14.07 11.96 10.32 SCR0509-4325 05 09 43.85 −43 25 17.4 15.12 13.00 10.71 SCR0513-7653 05 13 05.97 −76 53 21.9 14.54 12.32 11.23 SCR0526-4851 05 26 40.80 −48 51 47.3 13.82 11.67 10.02 SCR0607-6115 06 07 58.09 −61 15 10.5 15.75 13.43 11.13 SCR0643-7003 06 43 29.79 −70 03 20.8 13.95 11.51 9.75 SCR0644-4223AB 06 44 32.09 −42 23 45.2 15.59J 13.35J 11.18J SCR0713-0511 07 13 11.23 −05 11 48.6 11.76 9.31 8.84 SCR1107-3420B 11 07 50.25 −34 21 00.6 16.35 14.15 11.81 SCR1932-0652 19 32 46.33 −06 52 18.1 14.92 13.27 11.50 SCR2009-0113 20 09 18.24 −01 13 38.2 15.36 13.09 10.62 SCR2018-3635 20 18 06.52 −36 35 27.7 16.31 14.07 11.47 SCR2025-2259 20 25 18.93 −22 59 06.0 15.26 13.26 11.40 SCR2033-4903 20 33 01.87 −49 03 10.6 16.57 14.17 11.34 SCR2104-5248 21 04 53.85 −52 48 34.3 14.72 12.75 10.94 SCR2105-5503 21 05 13.78 −55 03 56.3 15.01 12.96 10.76 SCR2122-4314 21 22 16.92 −43 14 05.0 14.26 12.06 10.01 SCR2135-5325 21 35 39.63 −53 25 31.5 17.43 15.07 12.30 SCR2142-7405 21 42 58.54 −74 05 55.5 14.24 12.20 10.59 SCR2252-2220 22 52 25.82 −22 20 06.8 14.95 12.82 10.85 SCR2301-5530 23 01 32.51 −55 30 17.6 14.06 12.24 10.25 SCR2325-6740 23 25 25.13 −67 40 07.9 15.60 13.32 11.09

Note. — coordinates are epoch and equinox 2000.0 using Super- COSMOS positions transformed to epoch 2000.0 using the proper motions and position angles listed here; if AB, photometry or spectral type is for the system, i.e. joint. In the case of SCR0214-0733, no B plate magnitude was available in SuperCOSMOS.

– 27 –

Table 3. Photometric Results for SCR Sample

Name R.A. DEC. μ P.A. V_J R_{KC} I_{KC} # nts J H K_s d_{plt} σ_{plt} # rel d_{ccd} σ_{ccd} # rel V_{tan} SpType ref notes (^{′′}/yr) deg (pc) (pc) (pc) (pc) (km/s) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) (22)

SCR0017-3219 00 17 15.73 −32 19 54.0 0.220 096.9 15.45 14.11 12.39 2 10.64 10.08 9.73 21.0 7.3 11 21.3 3.4 12 22.2 —– 6 SCR0027-0806 00 27 45.36 −08 06 04.7 0.184 122.3 17.51 15.83 13.72 2 11.57 10.97 10.61 22.9 6.6 11 18.6 2.9 12 16.2 —– 6 SCR0111-4908 01 11 47.52 −49 08 08.9 0.542 213.1 17.72 15.92 13.75 2 11.54 11.00 10.61 23.6 10.8 11 17.6 2.8 12 45.1 M5.5V 3 SCR0113-7603 01 13 31.47 −76 03 09.3 0.228 125.1 16.07 14.62 12.83 2 11.03 10.47 10.13 21.7 5.6 11 22.8 3.6 12 24.6 —– 6 SCR0135-6127 01 35 53.66 −61 27 11.1 0.255 256.8 14.32 13.11 11.57 2 10.06 9.53 9.24 20.9 7.8 11 24.8 3.8 12 30.0 M3.5V 5 SCR0137-4148 01 37 23.49 −41 48 56.2 0.238 054.3 15.33 13.99 12.30 2 10.68 10.07 9.78 21.8 6.3 11 24.1 3.8 12 27.2 —– 6 SCR0138-5353 01 38 20.51 −53 53 26.1 0.297 071.0 14.36 13.20 11.70 2 10.28 9.69 9.42 24.3 7.4 11 29.7 4.6 12 41.8 M3.5V 5 SCR0150-3741 01 50 13.25 −37 41 52.0 0.230 112.3 14.47 13.23 11.64 2 10.11 9.54 9.24 21.5 6.0 11 22.8 3.5 12 24.9 —– 6 SCR0211-6108 02 11 35.42 −61 08 53.8 0.234 060.8 10.40 9.84 9.37 2 8.67 8.15 8.07 23.0 6.1 3 58.5 9.0 6 64.9 K2.0V 5 SCR0214-0733 02 14 44.69 −07 33 24.7 0.399 128.9 9.89 9.35 8.88 2 8.20 7.80 7.60 21.2 8.3 7 47.3 7.3 6 89.5 K1.0V 6^a SCR0232-8458 02 32 50.12 −84 58 09.5 0.220 141.9 11.47 10.65 9.90 2 9.00 8.34 8.18 25.0 8.9 6 43.3 7.2 8 45.2 K8.0V 5 SCR0246-7024 02 46 02.25 −70 24 06.3 0.259 113.2 14.86 13.44 11.61 4 9.84 9.33 9.02 20.0 8.1 11 14.2 2.3 12 17.5 M4.5V 5 SCR0325-0308 03 25 03.09 −03 08 20.4 0.197 082.7 13.88 12.79 11.41 2 10.06 9.45 9.20 24.8 7.4 11 31.5 4.9 12 29.4 —– 6 SCR0420-7005 04 20 12.55 −70 05 58.7 0.670 021.2 17.09 15.35 13.25 3 11.19 10.59 10.25 22.5 9.2 11 16.3 2.7 12 51.8 M5.5V 2,3 SCR0506-4712 05 06 07.29 −47 12 51.6 0.207 319.4 12.63 11.65 10.46 2 9.32 8.66 8.43 21.1 5.7 11 30.2 4.9 12 29.7 —– 6 SCR0509-4325 05 09 43.85 −43 25 17.4 0.225 324.9 14.09 12.83 11.21 2 9.61 9.00 8.74 18.0 5.2 11 16.5 2.6 12 17.6 —– 6 SCR0513-7653 05 13 05.97 −76 53 21.9 0.274 301.2 12.99 11.89 10.52 2 9.24 8.63 8.36 16.2 8.6 11 22.6 3.6 12 29.4 —– 6 SCR0526-4851 05 26 40.80 −48 51 47.3 0.279 158.7 12.88 11.79 10.43 2 9.10 8.46 8.24 20.1 5.3 11 20.7 3.3 12 27.3 —– 6 SCR0527-7231 05 27 06.99 −72 31 20.0 0.368 018.3 14.71 13.49 11.86 3 10.34 9.76 9.47 22.7 6.5 11 25.1 3.9 12 43.8 M3.5V 5 SCR0607-6115 06 07 58.09 −61 15 10.5 0.217 008.5 14.57 13.26 11.57 2 9.98 9.38 9.10 19.8 5.9 11 18.4 2.9 12 18.9 —– 6 SCR0630-7643AB 06 30 46.61 −76 43 08.9 0.483 356.8 14.82J 13.08J 11.00J 4 8.89J 8.28J 7.92J 6.9 2.0 11 5.5 0.9 12 12.5 M5.0V 2,3^{b c} SCR0631-8811 06 31 31.04 −88 11 36.6 0.516 349.9 15.65 14.05 12.04 3 10.04 9.46 9.07 12.8 5.1 11 10.4 1.6 12 25.5 M5.0V 3 SCR0635-6722 06 35 48.81 −67 22 58.5 0.383 340.0 11.54 10.62 9.64 2 8.54 7.96 7.69 22.7 6.3 11 26.1 4.2 11 47.3 M0.5V 5 SCR0640-0552 06 40 13.99 −05 52 23.3 0.592 170.5 10.22 9.22 8.03 3 6.84 6.21 5.96 8.5 2.3 11 9.3 1.5 12 26.2 M1.5V 4^d SCR0642-6707 06 42 27.17 −67 07 19.8 0.811 120.4 16.01 14.43 12.42 3 10.62 10.15 9.81 24.1 12.0 11 17.6 3.9 12 67.8 M5.0V 3 SCR0643-7003 06 43 29.79 −70 03 20.8 0.193 005.2 12.92 11.76 10.29 2 8.85 8.28 7.97 16.2 4.4 11 15.3 2.4 12 14.0 —– 6 SCR0644-4223AB 06 44 32.09 −42 23 45.2 0.197 163.8 14.44J 13.19J 11.55J 2 9.93J 9.27J 8.98J 18.8 5.2 11 17.5 2.9 12 16.3 —– 6^e SCR0702-6102 07 02 50.34 −61 02 47.6 0.786 041.4 16.62 14.75 12.49 3 10.36 9.85 9.52 15.9 7.6 11 10.8 2.0 12 40.2 M6.0V 2,3 SCR0713-0511 07 13 11.23 −05 11 48.6 0.304 183.6 11.13 10.08 8.86 3 7.65 7.08 6.82 13.1 4.7 10 13.5 2.1 12 19.4 M1.5V 6 SCR0717-0500 07 17 17.09 −05 01 03.6 0.580 133.6 13.29 12.02 10.39 3 8.87 8.35 8.05 15.9 5.8 8 13.2 2.2 12 36.2 M4.0V 4 SCR0723-8015 07 23 59.65 −80 15 17.8 0.828 330.4 17.41 15.61 13.41 2 11.30 10.82 10.44 19.3 5.6 11 17.1 3.1 12 67.2 M5.5V 2,3 SCR0736-3024 07 36 56.68 −30 24 16.4 0.424 145.7 13.64 12.41 10.83 2 9.36 8.79 8.50 20.2 9.0 11 17.3 2.7 12 34.7 M3.5V 4 SCR0740-4257 07 40 11.80 −42 57 40.3 0.714 318.1 13.81 12.36 10.50 3 8.68 8.09 7.77 10.0 2.9 11 7.2 1.1 12 24.5 M4.5V 4^f

– 28 –

Table 3—Continued

Name R.A. DEC. μ P.A. V_J R_{KC} I_{KC} # nts J H K_s d_{plt} σ_{plt} # rel d_{ccd} σ_{ccd} # rel V_{tan} SpType ref notes (^{′′}/yr) deg (pc) (pc) (pc) (pc) (km/s) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) (22)

SCR0754-3809 07 54 54.84 −38 09 37.8 0.401 351.4 15.46 13.91 11.98 3 10.01 9.42 9.08 12.0 3.5 11 11.3 1.7 12 21.4 M4.5V 4 SCR0805-5912 08 05 46.17 −59 12 50.4 0.637 155.0 14.69 13.38 11.68 3 10.07 9.52 9.22 20.4 6.0 11 19.4 3.1 12 58.7 M4.0V 3 SCR0838-5855 08 38 02.24 −58 55 58.7 0.320 188.9 17.15 15.08 12.78 2 10.31 9.71 9.27 8.5 2.5 11 8.0 1.3 12 12.1 M6.0V 5 SCR0914-4134 09 14 17.42 −41 34 37.9 0.749 312.5 15.01 13.57 11.72 3 9.98 9.42 9.12 18.2 8.0 11 14.6 2.4 12 51.9 M4.5V 4 SCR1107-3420B 11 07 50.25 −34 21 00.6 0.287 167.0 15.04 13.68 11.96 3 10.26 9.70 9.41 19.2 5.5 11 19.1 3.0 12 26.0 M4.0V 6^{g h} SCR1110-3608 11 10 29.01 −36 08 24.5 0.527 268.6 15.76 14.38 12.64 2 10.93 10.34 10.00 22.3 7.1 12 23.8 3.7 12 59.5 —– 4^i SCR1125-3834 11 25 37.27 −38 34 43.0 0.586 252.1 14.57 13.29 11.67 2 10.09 9.51 9.19 18.1 5.4 11 20.5 3.2 12 56.8 —– 4^j SCR1138-7721 11 38 16.76 −77 21 48.5 2.141 286.7 14.78 13.20 11.24 4 9.40 8.89 8.52 8.8 2.7 11 9.4 1.7 12 95.8 M5.0V 1,2,3 SCR1147-5504 11 47 52.49 −55 04 11.9 0.192 011.3 13.72 12.54 11.06 2 9.67 9.08 8.81 24.2 8.1 11 23.1 3.6 12 21.0 —— 5 SCR1157-0149 11 57 45.55 −01 49 02.6 0.451 116.4 15.99 14.54 12.68 2 10.91 10.35 10.02 22.2 6.5 11 21.3 3.4 12 45.6 M4.5V 4 SCR1204-4037 12 04 15.52 −40 37 52.6 0.695 150.0 13.47 12.34 10.92 2 9.57 9.02 8.75 21.2 5.7 11 25.2 3.9 12 83.0 —– 4^k SCR1206-3500 12 06 58.52 −35 00 52.0 0.422 229.3 14.67 13.35 11.66 2 10.01 9.40 9.13 21.0 5.9 11 17.7 2.7 12 35.4 —– 4 SCR1214-4603 12 14 39.98 −46 03 14.3 0.750 250.8 15.66 14.14 12.23 3 10.32 9.75 9.44 18.0 6.9 11 14.2 2.2 12 50.5 —– 4 SCR1217-7810 12 17 26.93 −78 10 45.9 0.212 056.6 16.43 14.92 13.05 2 11.20 10.64 10.36 24.5 8.6 11 23.3 3.8 12 23.4 —– 5 SCR1220-8302 12 20 03.71 −83 02 29.2 0.243 244.2 15.71 14.35 12.62 2 10.97 10.39 10.07 25.0 8.8 11 26.3 4.1 12 30.3 —– 5 SCR1224-5339 12 24 24.44 −53 39 08.8 0.189 251.9 15.31 13.95 12.19 2 10.51 9.93 9.65 18.2 5.5 11 21.0 3.3 12 18.8 —– 5 SCR1230-3411 12 30 01.75 −34 11 24.1 0.527 234.9 14.16 12.81 11.07 3 9.34 8.77 8.44 12.6 3.7 11 11.7 1.8 12 29.3 —– 4^l SCR1240-8116 12 40 56.02 −81 16 31.0 0.492 279.8 14.11 12.89 11.28 3 9.73 9.16 8.89 19.2 6.1 11 19.2 2.9 12 44.7 M4.0V 3 SCR1245-5506 12 45 52.53 −55 06 50.2 0.412 107.0 13.66 12.32 10.61 3 8.99 8.43 8.12 11.5 3.4 11 11.3 1.8 12 22.1 M4.0V 3 SCR1247-0525 12 47 14.73 −05 25 13.2 0.722 319.8 14.77 13.44 11.72 2 10.13 9.62 9.29 24.2 9.6 11 20.3 3.5 12 69.4 M4.0V 4 SCR1347-7610 13 47 56.80 −76 10 20.0 0.194 089.7 11.49 10.57 9.66 3 8.62 8.01 7.77 22.6 6.2 11 29.2 4.7 9 26.8 —– 5 SCR1420-7516 14 20 36.84 −75 16 05.9 0.195 243.7 13.78 12.55 10.95 2 9.44 8.91 8.63 21.4 6.7 11 17.9 2.9 12 16.6 —– 5 SCR1441-7338 14 41 14.42 −73 38 41.4 0.207 029.0 16.96 15.31 13.25 2 11.20 10.61 10.27 19.0 5.5 11 17.2 2.7 12 16.8 —– 5 SCR1444-3426 14 44 06.56 −34 26 47.2 0.451 187.7 14.17 12.89 11.26 2 9.74 9.18 8.88 24.0 7.5 11 18.8 3.0 12 40.1 —– 4^m SCR1448-5735 14 48 39.82 −57 35 17.7 0.202 188.8 11.15 10.47 9.92 2 9.15 8.56 8.43 18.3 17.5 6 62.4 9.7 6 59.7 —– 5 SCR1450-3742 14 50 02.85 −37 42 09.8 0.449 212.2 14.01 12.84 11.32 2 9.95 9.37 9.07 21.2 6.0 11 25.9 4.2 12 55.1 —– 4^n SCR1456-7239 14 56 02.29 −72 39 41.4 0.207 225.0 15.36 13.99 12.28 2 10.62 10.06 9.74 24.9 7.0 11 22.8 3.6 12 22.4 —– 5 SCR1511-3403 15 11 38.63 −34 03 16.6 0.561 202.9 14.45 13.22 11.60 2 10.05 9.42 9.13 16.1 7.4 11 20.5 3.2 12 54.4 —– 4^o SCR1532-3622 15 32 13.90 −36 22 30.9 0.438 235.4 14.03 12.89 11.45 2 10.10 9.54 9.28 23.0 10.3 11 31.5 5.0 12 65.4 —– 4^p SCR1601-3421 16 01 55.68 −34 21 56.8 0.683 118.3 16.18 14.71 12.86 2 10.96 10.33 9.98 20.2 11.9 11 18.7 3.0 12 60.4 —– 4^q SCR1630-3633AB 16 30 27.23 −36 33 56.1 0.413 249.2 14.95J 13.47J 11.59J 2 10.04J 9.50J 9.03J 14.8 5.9 11 15.4 3.8 12 30.1 —– 4^r SCR1637-4703 16 37 56.62 −47 03 44.4 0.503 215.4 14.77 13.57 12.04 3 10.60 10.04 9.70 20.8 13.7 9 32.0 5.1 12 76.2 —– 4 SCR1726-8433 17 26 22.90 −84 33 08.2 0.518 134.8 14.25 13.00 11.41 2 9.87 9.33 9.02 20.1 5.5 11 20.6 3.2 12 50.6 M4.0V 3

– 29 –

Table 3—Continued

Name R.A. DEC. μ P.A. V_J R_{KC} I_{KC} # nts J H K_s d_{plt} σ_{plt} # rel d_{ccd} σ_{ccd} # rel V_{tan} SpType ref notes (^{′′}/yr) deg (pc) (pc) (pc) (pc) (km/s) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) (22)

SCR1738-5942 17 38 41.02 −59 42 24.4 0.280 148.2 14.95 13.65 11.96 2 10.38 9.83 9.58 20.8 6.0 11 24.0 4.0 12 31.9 —– 5 SCR1746-8211 17 46 21.54 −82 11 56.6 0.228 184.9 12.44 11.33 9.91 2 8.55 7.99 7.71 14.6 4.0 11 15.5 2.4 12 16.7 —– 5^s SCR1820-6225 18 20 49.35 −62 25 52.7 0.190 164.8 12.04 11.12 10.17 2 9.14 8.49 8.30 22.5 9.5 8 36.6 5.8 10 33.0 —– 5 SCR1826-6542 18 26 46.83 −65 42 39.9 0.311 178.9 17.35 15.28 12.96 3 10.57 9.96 9.55 9.2 2.5 11 9.3 1.5 12 13.7 —– 5 SCR1841-4347 18 41 09.81 −43 47 32.8 0.790 264.2 16.46 14.72 12.59 3 10.48 9.94 9.60 14.6 4.3 11 11.9 2.0 12 44.5 —– 4 SCR1845-6357AB 18 45 05.26 −63 57 47.8 2.558 074.7 17.40J 14.99J 12.46J 5 9.54J 8.97J 8.51J 3.5 1.2 6 4.6 0.8 10 56.3 M8.5V 1,2,3^{t u} SCR1847-1922 18 47 16.69 −19 22 20.8 0.626 230.7 14.35 13.11 11.48 2 9.91 9.38 9.09 23.0 6.6 11 20.6 3.2 12 61.1 —– 4 SCR1853-7537 18 53 26.61 −75 37 39.8 0.304 168.7 11.18 10.29 9.41 2 8.34 7.73 7.50 20.1 6.1 11 25.9 4.4 10 37.3 —– 5^v SCR1855-6914 18 55 47.89 −69 14 15.1 0.832 145.3 16.61 14.79 12.66 3 10.47 9.88 9.51 12.5 4.5 11 10.7 1.7 12 42.1 M5.5V 3 SCR1856-4704AB 18 56 38.40 −47 04 58.3 0.252 131.3 14.85J 13.55J 11.87J 2 10.29J 9.75J 9.45J 21.4 6.2 11 22.6 3.6 12 27.0 —– 5^w SCR1926-8216AB 19 26 48.64 −82 16 47.6 0.195 172.5 11.29J 10.55J 9.89J 3 9.04J 8.43J 8.31J 17.3 4.7 3 53.4 8.5 6 49.3 —– 5^x SCR1931-0306 19 31 04.61 −03 06 18.0 0.578 031.0 16.81 15.11 13.11 3 11.15 10.56 10.23 18.0 4.8 6 18.0 3.0 12 49.2 M5.0V 4 SCR1932-0652 19 32 46.33 −06 52 18.1 0.318 193.3 13.97 12.83 11.34 2 9.94 9.36 9.10 23.7 9.1 11 26.7 4.1 12 40.2 —– 6 SCR1932-5005 19 32 48.64 −50 05 38.9 0.257 157.5 15.47 14.14 12.42 2 10.75 10.11 9.85 24.4 7.8 11 23.5 3.7 12 28.6 —– 5 SCR1959-3631 19 59 21.03 −36 31 03.7 0.436 158.1 11.07 10.19 9.31 2 8.24 7.62 7.41 19.8 5.4 8 25.0 4.3 10 51.6 —– 4^y SCR1959-6236 19 59 33.55 −62 36 13.4 0.189 288.7 16.27 14.82 12.96 2 11.07 10.49 10.23 24.4 7.2 11 21.9 3.4 12 19.6 —– 5 SCR2009-0113 20 09 18.24 −01 13 38.2 0.381 186.2 14.47 12.98 11.16 3 9.40 8.83 8.51 14.0 4.4 11 10.8 1.8 12 19.5 —– 6 SCR2016-7531 20 16 11.25 −75 31 04.5 0.253 081.3 15.84 14.28 12.35 3 10.47 9.86 9.51 16.2 4.8 11 14.3 2.3 12 17.1 —– 5^z SCR2018-3635 20 18 06.52 −36 35 27.7 0.237 125.0 14.63 13.38 11.75 2 10.21 9.67 9.44 20.7 6.9 11 24.9 4.1 12 28.0 —– 6 SCR2025-2259 20 25 18.93 −22 59 06.0 0.191 219.5 14.22 13.03 11.48 2 10.00 9.48 9.16 23.5 7.0 11 24.6 3.8 12 22.2 —– 6 SCR2033-4903 20 33 01.87 −49 03 10.6 0.261 150.4 15.34 13.85 11.98 2 10.11 9.52 9.19 16.5 6.4 11 13.2 2.1 12 16.4 —– 6 SCR2040-5501 20 40 12.38 −55 01 25.6 0.514 125.4 15.22 13.91 12.22 2 10.56 10.02 9.69 22.9 6.9 11 23.3 3.6 12 56.8 M4.0V 3 SCR2042-5737AB 20 42 46.44 −57 37 15.3 0.264 142.6 14.12J 12.89J 11.33J 3 9.97J 9.53J 9.03J 22.7 8.5 11 25.3 6.0 12 31.6 —– 5^A SCR2104-5248 21 04 53.85 −52 48 34.3 0.326 182.7 13.66 12.52 11.08 2 9.72 9.10 8.83 22.1 6.4 11 24.5 3.8 12 37.9 —– 6 SCR2105-5503 21 05 13.78 −55 03 56.3 0.334 171.0 13.97 12.69 11.05 2 9.59 8.92 8.64 17.1 4.8 11 16.7 2.8 12 26.4 —– 6 SCR2122-4314 21 22 16.92 −43 14 05.0 0.262 184.7 13.39 12.17 10.61 3 9.13 8.53 8.21 17.0 4.7 11 14.9 2.3 12 18.5 —– 6 SCR2130-7710 21 30 07.00 −77 10 37.5 0.589 118.0 17.01 15.33 13.31 2 11.29 10.67 10.37 20.6 7.3 11 18.4 2.9 12 51.3 M4.5V 3^B SCR2135-5325 21 35 39.63 −53 25 31.5 0.191 332.4 15.88 14.39 12.54 2 10.80 10.25 9.92 20.8 6.7 11 20.7 3.6 12 18.8 —– 6 SCR2142-7405 21 42 58.54 −74 05 55.5 0.210 162.1 13.06 12.02 10.74 2 9.46 8.78 8.58 21.9 6.3 11 26.7 4.5 12 26.5 —– 6 SCR2230-5244 22 30 27.95 −52 44 29.1 0.369 125.7 17.37 15.91 13.88 2 11.85 11.24 10.91 24.7 7.1 6 24.8 4.2 12 43.4 —– 5 SCR2241-6119A 22 41 44.36 −61 19 31.2 0.184 124.0 14.41 13.21 11.66 2 10.21 9.61 9.35 23.2 7.3 11 26.6 4.1 12 23.2 —– 5 SCR2241-6119B 22 41 43.67 −61 19 39.4 0.287 108.0 19.15 17.23 14.96 2 12.64 12.05 11.68 27.8 16.5 11 26.2 4.1 12 35.6 —– 5^C SCR2252-2220 22 52 25.82 −22 20 06.8 0.299 187.6 13.71 12.56 11.10 2 9.70 9.11 8.86 21.3 5.7 11 24.1 3.7 12 34.2 —– 6

– 30 –

Table 3—Continued

Name R.A. DEC. μ P.A. V_J R_{KC} I_{KC} # nts J H K_s d_{plt} σ_{plt} # rel d_{ccd} σ_{ccd} # rel V_{tan} SpType ref notes (^{′′}/yr) deg (pc) (pc) (pc) (pc) (km/s) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) (22) SCR2301-5530 23 01 32.51 −55 30 17.6 0.338 052.8 12.65 11.57 10.25 2 8.98 8.36 8.13 15.1 4.5 11 21.4 3.3 12 34.3 —– 6 SCR2307-8452 23 07 19.67 −84 52 03.9 0.613 097.2 15.13 13.76 12.00 2 10.36 9.81 9.47 20.6 5.9 11 19.9 3.2 12 57.8 M4.0V 3 SCR2325-6740 23 25 25.13 −67 40 07.9 0.284 123.2 14.38 13.11 11.48 2 9.91 9.33 9.05 20.0 5.7 11 19.5 3.0 12 26.2 —– 6^D SCR2335-6433A 23 35 18.43 −64 33 42.4 0.196 103.1 11.20 10.42 9.64 2 8.64 8.02 7.86 24.5 6.9 8 35.9 6.4 9 33.3 —– 5 SCR2335-6433B 23 35 19.95 −64 33 22.3 0.196 099.1 15.65 14.49 13.00 2 11.60 11.02 10.76 57.6 15.4 11 56.7 8.8 12 52.7 —– 5^E

Note. — coordinates are epoch and equinox 2000.0 using SuperCOSMOS positions transformed to epoch 2000.0 using the proper motions and position angles listed here; if AB, photometry or spectral type is for the system, i.e. joint.

Note. — (1): Hambly et al. 2004; (2): Henry et al. 2004; (3): Subasavage et al. 2005a; (4): Subasavage et al. 2005b; (5): Finch et al. 2007; (6): this paper. a BD −08 409 b AB separation 1^{′′} c SIPS J0630-7643 d BD −05 1737 e angular separation of 1.6^{′′} at a position angle of 266.4^∘ f LSR J07401-4257 g SCR1107-3420A is a white dwarf.

h angular separation of 30.6^{′′} at a position angle of 107.1^∘ i LSR J11104-3608 j LSR J11256-3834 k LSR J12042-4037 l LSR J12300-3411 m LSR J14441-3426 n LSR J14500-3742

– 31 –

o LSR J15116-3403 p LSR J15322-3622 q LSR J16019-3421 r angular separation of 2^{′′} at a position angle of 247.2^∘ s possible companion to HD158866 at 76.5^{′′} at a position angle of 290.8^∘ t DENIS-P J184504.9-635747 u angular separation of 1.2^{′′} at a position angle of 170.2^∘ v USNO-B1.0 0143-00184491 w angular separation of 1.1^{′′} at a position angle of 139.9^∘ x angular separation of 1.4^{′′} at a position angle of 238.8^∘ y CD −36 13808 z SIPS J2016-7531 A angular separation of 2.2^{′′} at a position angle of 338.4^∘ B SIPS J2130-7710 C angular separation of 9.6^{′′} at a position angle of 211.2^∘ D LEHPM 5810 E angular separation of 22.4^{′′} at a position angle of 25.9^∘

– 32 –

Table 4. Binary Data for SCR Sample

Name sep P.A. d_{ccd} σ_{ccd} notes (^{′′}) (deg) (pc) (pc)

SCR0630-7643A 8.8 0.9 a SCR0630-7643B 1.0 33.8 [5.5] 0.9

SCR0644-4223A [17.5] 2.9 SCR0644-4223B 1.6 266.4 [17.5] 2.9

SCR1107-3420A 28.2 3.0 b SCR1107-3420B 30.6 107.1 19.1 3.0 b

SCR1630-3633A [15.4] 3.8 SCR1630-3633B 2.0 247.2 [15.4] 3.8

HD158866 30.6 0.9 c SCR1746-8211 76.5 290.8 15.5 2.4 c

SCR1845-6357A 3.9 0.8 a SCR1845-6357B 1.2 170.2 [4.6] 0.8 d

SCR1856-4704A [22.6] 3.6 SCR1856-4704B 1.1 138.9 [22.6] 3.6

SCR1926-8216A [53.4] 8.5 SCR1926-8216B 1.4 238.8 [53.4] 8.5

SCR2042-5737A [25.3] 6.0 SCR2042-5737B 2.2 338.4 [25.3] 6.0

SCR2241-6119A 26.6 4.1 e SCR2241-6119B 9.6 211.2 26.2 4.1 e

SCR2335-6433A 35.9 6.4 e SCR2335-6433B 22.4 25.9 56.7 8.8 e

Note. — Brackets around the distance estimate indicate that the estimate is for the system

atrigonometric parallax in Henry et al. 2006

bseparation and position angle for the system and distance estimate for the primary (derived from the SED) are from Subasavage et al. 2007

cseparation and position angle for the system from Finch et al. 2007; trigonometric distance for the primary is from van Leeuwen 2007 (HIPPAR- COS)

dseparation and position angle for the system

– 33 –

from Biller et al. 2006 eseparation and position angle for the system from Finch et al. 2007

– 34 –

Table 5. Distance Statistics for SCR Sample of M Dwarf Systems

Distance # systems # binaries^a d ≤ 5.0 pc 1 1 5.0 < d ≤ 10.0 pc 6 1 10.0 < d ≤ 15.0 pc 16 0 15.0 < d ≤ 20.0 pc 23 2 20.0 < d ≤ 25.0 pc 31 1 d ≥ 25.0 pc 23 4 TOTAL 100 9 aomitting SCR1107-3420B and SCR1746- 8211, both of which have primaries that are not M dwarfs