arXiv:1007.3186v1 [astro-ph.SR] 19 Jul 2010

UCAC3 Proper Motion Survey. I.

DISCOVERY OF NEW PROPER MOTION STARS IN UCAC3 WITH 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1} BETWEEN DECLINATIONS −90^∘ and −47^∘

Charlie T. Finch, Norbert Zacharias

finch@usno.navy.mil

U.S. Naval Observatory, Washington DC 20392–5420

Todd J. Henry

Georgia State University, Atlanta, GA 30302–4106

ABSTRACT

Presented here are 442 new proper motion stellar systems in the southern sky between declinations −90^∘ and −47^∘ with 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1}. These systems constitute a 25.3% increase in new systems for the same region of the sky covered by previous SuperCOSMOS RE- CONS (SCR) searches that used Schmidt plates as the primary source of discovery. Among the new systems are 25 multiples, plus an additional seven new common proper motion companions found to previously known primaries. All stars have been discovered using the third U.S. Naval Observatory (USNO) CCD Astrograph Catalog (UCAC3). A comparison of the UCAC3 proper motions to those from the Hipparcos, Tycho-2, Southern Proper Motion (SPM4), and SuperCOS- MOS efforts is presented, and shows that UCAC3 provides similar values and precision to the first three surveys. The comparison between UCAC3 and SuperCOSMOS indicates that proper motions in RA are systematically shifted in the SuperCOSMOS data but are consistent in DEC data, while overall showing a significantly higher scatter. Distance estimates are derived for stars having SuperCOSMOS Sky Survey (SSS) B_J , R_{59F} , and I_{IV N} plate magnitudes and Two-Micron All Sky Survey (2MASS) infrared photometry. We find 15 systems estimated to be within 25 pc, including UPM 1710-5300 our closest new discovery estimated at 13.5 pc. Such new discoveries suggest that more nearby stars are yet to be found in these slower proper motion regimes, indicating that more work is needed to develop a complete map of the solar neighborhood.

Subject headings: solar neighborhood — stars: distances — stars: statistics — surveys — astrometry

1. INTRODUCTION

Proper motion surveys were once in the forefront of astronomy research. Providing a vast library of low mass stars, proper motion surveys provide a wealth of information to astronomers studying stellar populations, and in particular the stellar luminosity and mass functions that reveal how the Galaxy’s stellar mass is divided among different types of stars. Proper motion surveys of faint objects, such as red dwarfs, subdwarfs, and white dwarfs, play a crucial role in identifying the Sun’s nearest neighbors.

Historically, proper motion studies have been carried out by blinking photographic plates taken at different epochs to detect the changing positions of stars. The pioneering surveys of the second half of the last century include the Lowell Proper Motion Survey (Giclas et al. 1971; Giclas et al. 1978), the Luyten Half-Second catalog (LHS) (Luyten 1979) and the New Luyten Two-Tenths catalog (NLTT) (Luyten 1980). With the aid of plate scanning machines and high powered computers, the traditional techniques used for proper motion studies are carried out in much the same way, only now using digitized images of the photographic plates. Utilizing various techniques and plate sets, these new computerized searches have revealed many new proper motion systems. Recent surveys of the southern sky — the region targeted by the present effort — include (Wroblewski & Costa 1999), (Scholz et al. 2000; Scholz et al. 2002), (Oppenheimer et al. 2001), the Southern Infrared Proper Motion Survey (SIPS) (Deacon et al. 2005; Deacon & Hambly 2007), the IPHAS-POSS-I proper motion survey of the Galactic plane (Deacon et al. 2009) and Lepine’s SUPERBLINK survey (Lépine 2005; Lépine 2008).

The Research Consortium On Nearby Stars (RECONS) group^1 has also been systematically canvassing the southern sky for new proper motion systems as part of their effort to understand the stellar population of the solar neighborhood. To date, these discoveries have been reported in five of the The Solar Neighborhood (TSN) series of papers (Hambly et al. 2004; Henry et al. 2004; Subasavage et al. 2005a; Subasavage et al. 2005b; Finch et al. 2007). The new systems are given SCR (SuperCOSMOS-RECONS) names because they have been discovered using the SuperCOS- MOS Sky Survey (SSS) data (Hambly et al. 2001a). The RECONS group continues to operate a trigonometric parallax program at the CTIO 0.9m telescope to confirm stars within 25 pc, with a focus on stars within 10 pc. In Table 1, we summarize the number of new stellar systems reported to be within 25 pc by RECONS and others via proper motion surveys that have distance estimates derived from photographic relations.

In this investigation we focus on stars in the newly released third U.S. Naval Observatory (USNO) CCD Astrograph Catalog (UCAC3) (Zacharias et al. 2010) found between declinations −90^∘ and −47^∘ that have 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1}, where μ is the proper motion. The search region and proper motion range match that in The Solar Neighborhood XVIII (hereafter, TSN18) (Finch et al. 2007), in which the lower proper mo-

1www.recons.org

tion cutoff was chosen to match that of the NLTT catalog. In TSN18 we presented 1606 new SCR systems, including 54 candidate common proper motion multiples. By utilizing the UCAC3 catalog with proper motions determined without the sole use of photographic plates, we can probe for new proper motion stars and companions that have been overlooked during previous searches. The new objects reported here have been dubbed UPM, for this new USNO Proper Motion search.

2. Method

2.1. UCAC3

The USNO CCD Astrograph Catalog (UCAC) project has been producing astrometric catalogs since October 2000, with the first release (UCAC1) (Zacharias et al. 2000) covering only 80% of the southern sky. The second catalog in this series (UCAC2) (Zacharias et al. 2004) was released in July 2003 with about the same level of completeness as UCAC1, but with early epoch plates paired with the Astrograph CCD data for improved proper motions. The UCAC3, released in August 2009, is the first from the series to have all sky coverage, and contains just over 100 million entries with a limiting magnitude of ∼16 in the UCAC bandpass (579-642 nm). UCAC3 also includes double star fitting, and has a slightly deeper limiting magnitude than UCAC2 due to a complete re-reduction of the pixel data (Zacharias 2010). A detailed introduction to the UCAC3 can be found in the release paper (Zacharias et al. 2010) and the README file of the data distribution.

The UCAC3 has been used in the present survey to probe for proper motion stars that have been overlooked during previous SCR and other searches. The Two-Micron All Sky Survey (2MASS) was used to probe for and reduce systematic errors in UCAC CCD observations, giving a greater number of reference stars to stack up residuals as a function of many parameters, such as observing site and exposure time. A detailed description of the astrometric reductions of UCAC3 can be found in (Finch et al. 2010).

2.2. PROPER MOTIONS

Out of the roughly 100 million stars in the UCAC3 catalog, about 95 million have calculated absolute proper motions. Most proper motions are derived using the Astrograph CCD data combined with various earlier epoch catalogs in much the same manner as UCAC2. All input catalogs are reduced to the International Celestial Reference Frame (ICRF) by utilizing Hipparcos data or a similar, denser catalog, such as Tycho- 2. For each position, standard errors are estimated. These errors are then used as weights to compute a UCAC3 mean position and proper motion, utilizing a weighted, least-squares adjustment procedure. For bright stars (R∼8–12), UCAC Astrograph CCD data were combined with ground-based photographic and transit circle catalogs, including all catalogs used for the Tycho-2 project (Høg et al. 2000), and ∼1.2 million positions from about 1950 AGK2 plates derived using the StarScan machine (Zacharias et al. 2008). For fainter stars (R∼12.5–16.5), UCAC Astrograph CCD data were combined with scans from the StarScan machine of roughly 3200 plates from the Hamburg Zone Astrograph, the USNO Black Birch Astrograph, and the Lick Astrograph, as well as a complete new reduction of the Yale Southern Proper Motion (SPM4) survey (Girard et al. 2010), and data from the SuperCOSMOS project (Hambly et al. 2001a). The SuperCOSMOS data were used in place of the Northern Proper Motions (NPM) (Girard et al.), in preparation, which was not complete when the UCAC3 was generated, but which will be included in the anticipated UCAC4 final release. An estimated error floor has been added to all catalogs used for the proper motion calculation. The largest root mean square (RMS) error contribution added was 100 mas for the SuperCOSMOS data due to zonal (plate pattern) systematic errors in the range of 50 to 200 mas, when compared to 2MASS data. For a detailed description of the derived UCAC3 proper motions see (Zacharias et al. 2010).

An effort was made to tag previously known High Proper Motion (HPM) stars in the UCAC3 catalog using the VizieR on-line data tool, along with published literature. The list includes roughly 51000 known proper motion stars covering the entire sky with μ > ∼0.^{′′}18 yr^{−1}. In the North we used the LSPM-North catalog (Lépine 2005) containing 61977 new and previously found stars having proper motions greater than 0.^{′′}15 yr^{−1}. In the South we used many smaller surveys along with the Revised NLTT Catalog (Salim & Gould 2003), which produced 17730 stars with proper motions greater than 0.^{′′}15 yr^{−1}. For a full list of catalogs used see the UCAC3 README file. This list is not comprehensive due to not having a complete list of proper motion surveys and the dificulty in matching some catalogs like the NLTT which do not have reliable positions. The proper motion values given in UCAC3 for these previously known stars come from the individual catalogs themselves and are not derived in the same manner as the UCAC3 proper motions mentioned above. These previously known proper motion stars are flagged in the UCAC3 data with a Mean Position (MPOS) running star number greater than 140 million.

The errors in proper motions reported in the UCAC3 release for stars brighter than mag 12 are only ∼1–3 mas/yr because of the large epoch spread, oftentimes as long as 100 years. For fainter stars found in SPM4, the errors are ∼2–3 mas/yr, while proper motions incorporating SuperCOS- MOS data result in errors of ∼6–8 mas/yr.

2.3. SEARCH CRITERIA

The initial sample of 177231 proper motion candidates for this search included all UCAC3 stars in the southern sky between declinations −90^∘ and −47^∘ with 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1}. Winnowing of the sample was accomplished by examining previously known proper motion stars meeting the survey criteria to find a combination of UCAC3 flags with values indicative of real proper motion objects. To verify the set of flags adopted for final target selection, visual inspections were done of targets in selected sky regions to confirm true proper motion. In addition to meeting the declination and proper motion survey limits, all stars (1) must be in the 2MASS catalog with an e2mpho (2MASS photometry error) less than or equal to 0.05 magnitudes in all three bands, (2) have a UCAC fit model magnitude between 7 and 17 mag, (3) have a double star flag (dsf) equal to 0, 1, 5 or 6, meaning a single star or fitted double, (4) have an object flag (objt) between −2 and 2 to exclude positions that used all overexposed images in the fit, (5) have an MPOS number less than 140 million to exclude already known high proper motion stars, and (6) have a LEDA galaxy flag of zero, meaning that the source is not in the

LEDA galaxy catalog. After implementing these cuts, 9248 candidates remained.

These candidates were then cross-checked via VizieR, the published literature, and SIMBAD to determine if they were previously known. VizieR was used to cross-check various proper motion catalogs, such as NLTT, Hipparcos, and Tycho-2. If a survey was not available on VizieR, data were obtained from the published literature (as in the case for stars found in TSN18, which has only recently been added to the VizieR database.) A final search was done by checking the remaining candidates against the SIMBAD database. Cross-checks of the various compendia were performed using a 90^{′′} search radius, with one exception (the NLTT catalog, see below). If a candidate was matched to a known proper motion star having roughly the same proper motion and magnitude, then it was labeled as previously known, and is not included in the sample reported here.

A larger search radius of 180^{′′} was used when comparing UPM candidates to the NLTT catalog, which is known to have inaccurate positions. As shown in the Figure 2 histogram of (Bakos et al. 2002), the distances between their measured positions and Luyten’s listed positions of LHS stars can be quite large. The number of objects with a given position offset levels off around 90^{′′}, beyond which fewer than 10 objects per 1^{′′} bin are found. Thus, UCAC3 proper motion candidates with positions differing from Luyten’s by less than 90^{′′} are considered known, those differing by 90–180^{′′} are considered new discoveries but are noted as possible NLTT stars in the tables, and those differing by more than 180^{′′} are considered new discoveries. It is not a goal of this paper to revise the NLTT catalog and assign proper identifications and accurate positions to NLTT entries; rather, the goal is to identify new high proper motion stars.

The various cross-checks for previously known stars reduced the number of new candidates to a list of 4425. Each was visually inspected to verify proper motion by blinking the B_J and R_{59F} SuperCOSMOS digitized plate images. Objects without verifiable proper motions were then discarded, leaving 474 new proper motion discoveries. Of these new discoveries 32 were found to be part of a Common Proper Motion (CPM) system, including seven new discoveries having CPM to previously known primaries, leaving a total of 442 new systems.

A lower successful hit rate (5297 real proper motion objects / 9248 total “good” candidates extracted) of 57.3% was found for this search than the 78.1% successful hit rate obtained in TSN18. As in TSN18, the hit rate takes into account new, known, and phantom proper motion objects (phantoms are identified as moving objects but are not). The lower hit rate in the present effort is the result of at least three factors. First, some real objects were discarded early in the search due to the rigorous sifting mentioned above to obtain a more manageable sample for investigating, i.e. some of the selection criteria, particularly involving 2mass, were “too tight.” Second, many phantom proper motion objects in the UCAC3 made the sample cuts because of incorrect matches between catalogs during the proper motion calculation. This is particularly common in the fainter stars for which the proper motion calculations rely on only two catalog positions. Third, other misidentifications arise from blended images, where two single star detections in the UCAC3 can be matched up to a single image in an earlier epoch catalog.

3. RESULTS

The 442 new UCAC3 proper motion systems are listed in Table 2. In Table 3 we highlight the 15 systems for which we estimate distances to be less than 25 pc. In both Tables we list names, coordinates, proper motions, 1σ errors in the proper motions, plate magnitudes from SuperCOSMOS, near-IR photometry from 2MASS, the computed R_{59F} − J color, distance estimate, and notes.

3.1. Positions and Proper Motions

All positions on the ICRF system, proper motions, and errors are taken directly from UCAC3. For a few stars found visually, e.g. companions, no data could be obtained from UCAC3, so information was obtained from other sources (additional objects, see below). The average positional errors reported in the UCAC3 catalog for this sample are 52 mas in RA and 53 mas in Dec. The average proper motion errors are 8.5 mas/yr in μ_α cos δ and 8.4 mas/yr in μ_δ.

3.2. Photometry

In Tables 2 and 3, we give photographic magnitudes from SuperCOSMOS for three plate emulsions: B_J , R_{59F} , and I_{IV N} . For sources fainter than mag ∼15, plate errors are typically less than 0.3 mag, but errors increase for brighter sources. Plate color errors are smaller, at roughly 0.07 mag (Hambly et al. 2001b). 2MASS JHK_s infrared photometry is given, with errors typically 0.05 mag or less due to the search criteria and because the stars are usually brighter than 16 in UCAC3 and are red, making them relatively bright, mag ∼ 10–14, in 2MASS. Companions found during visual inspection may be fainter and have consequently larger photometric errors. The optical (SuperCOSMOS) and infrared (2MASS) datasets are combined in a computed R_{59F} −J color to provide an indicator of the star’s color. In some cases, SuperCOSMOS magnitudes may not be given due to blending, no source detection or other problems where no magnitude is reported in the SuperCOS- MOS data. 2MASS magnitudes are given for all but five objects that are not present in the 2MASS catalog.

3.3. Distances

Distance estimates are computed using 11 colors generated from the six-band photometry using the relations given in (Hambly et al. 2004). This method assumes that all objects are main sequence stars. The accuracy reported for this technique is roughly 26%, which is determined from the mean of the absolute values of the differences between distances for stars with trigonometric parallaxes and distances estimated via the relations. No distance estimate is given for stars that are too blue for the relations. For objects with incomplete photometry, the distance estimate will be less reliable. While only one relation is needed to produce a distance estimate, six are needed to be considered “reliable.” This is half of the 11 total posibilities. Stars having fewer than six relations have been identified in the notes. For any star expected to have an erroneous distance (white dwarf, evolved star, subdwarf), the distance is given in brackets.

3.4. Additional Objects

During the visual inspection of the candidates, 27 additional proper motion objects were found, listed in Table 4. These objects generally are CPM companion candidates that either have a fainter limiting magnitude than implemented for this search, were eliminated from the candidate list by the search criteria, or have a UCAC3 proper motion less than 0.^{′′}18 yr^{−1}. Proper motions from the UCAC3 data less than the 0.^{′′}18 yr^{−1} cutoff of this paper are considered suspect from a visual inspection that compared the proper motion of the companion candidate. All objects detected during the visual inspection were investigated using SIMBAD and VizieR for previous identifications. If none were found, their proper motions were obtained from UCAC3, SPM4, or SuperCOSMOS, in that order of priority. Magnitudes were then obtained from SuperCOSMOS and 2MASS to compute distance estimates. Only four of the 27 objects found visually did not have a proper motion reported in any catalog. For stars that were not found in the UCAC3 data, positions were computed using the epoch, coordinates, and proper motion obtained from the corresponding catalog.

4. ANALYSIS

4.1. Color-Magnitude Diagram

In Figure 1 we show a color-magnitude diagram of the 465 proper motion objects reported in this sample having a R_{59F} − J color. New proper motion objects are represented by closed circles while known objects (companions to new objects) are represented by open circles. Data points that fall below R_{59F} ∼ 17 are CPM companion candidates noticed during visual inspection. The brightest new object, UPM 1542-5041, has R_{59F} = 9.924 and is estimated to be at a distance of 33.1 pc. The reddest object found in this search is UPM 1703-4934B with R_{59F} − J = 6.30, R_{59F} = 17.31, and estimated distance of 40.7 pc.

The subdwarf population is not as well defined in this paper as in TSN18 because there are far fewer new objects. Nonetheless, a separation can be seen below the concentration of main sequence stars. Finally, a single known white dwarf, WD 0607-530B, can be seen in the lower left of Figure 1.

4.2. Reduced Proper Motion Diagram

We show in Figure 2 the Reduced Proper Motion (RPM) diagram for all 465 objects in this sample having a R_{59F} − J color. New proper motion objects are represented by closed circles while known objects (companions to new objects) are represented by open circles. A reduced proper motion diagram takes advantage of the assumption that objects with larger distances tend to have smaller proper motions. While this is not always valid it can be used as a good method to separate white dwarfs and subdwarfs from main-sequence stars. We determine H_R as in TSN18 using a modified distance modulus equation, in which μ is substituted for distance.

H_R = R_{59F} + 5 + 5 log μ.

The dashed line in Figure 2 is the same empirical line used in TSN18 to separate white dwarfs from subdwarfs. This separation line has been shown from past SCR searches to be reliable in identifying white dwarf candidates. From the present survey, only one known white dwarf WD 0607-530B, a CPM companion candidate to UPM 0608-5301A, is seen clearly below the subdwarf region.

Subdwarf candidates have been selected using the same method as in TSN18 — stars with R_{59F} −J > 1.0 and within 4.0 mag in H_R of the the empirical line separating the white dwarfs are considered subdwarfs. From this survey there are 31 subdwarf candidates, all with distance estimates greater than 147 pc. Large distance estimates can be used to identify both subdwarf and white dwarf candidates, which are subluminous compared to main sequence stars and yield large distance estimates because they are intrinsically fainter than the main-sequence stars used to generate the photometric distance relations. The presumably erroneous distances for these stars are given in brackets in Tables 2 and 3. Follow up spectroscopic observations will be needed to confirm all subdwarf candidates.

4.3. New Common Proper Motion Systems

In this search we found 32 common proper motion systems (31 binaries and one triple), including 25 entirely new systems and seven hybrid systems containing both new and known objects. The triple system is a previously known system discovered as part of the automated search to have a newly discovered third component. The data for these systems are given in Table 4, where we list the primaries and companions, their proper motions, and the companions’ separations and position angles relative to the primaries (defined to be the brightest star in each system). The distance estimates were used in conjunction with the proper motions and visual inspections to determine whether or not a pair of stars is physically associated. Because these objects were found during visual inspections, the proper motion and/or SuperCOSMOS magnitudes may be missing or suspect; in such cases, identifications as CPM systems are more tentative and identified in the notes.

In Figure 3 we compare the proper motions per coordinate for the 29 CPM systems for which both components have proper motions. CPM candidates that have proper motions from UCAC3 are represented by closed circles while those with proper motions from other sources are represented by open circles. Proper motions for the latter candidates were extracted manually from either SPM4 or SuperCOSMOS.

4.4. Notes on Specific Stars

UPM 0608-5301A is an M dwarf at an estimated distance of 37.1 pc with a known white dwarf as a possible companion. The B component (known white dwarf) is at a separation of 21.5^{′′} at position angle 120.7^∘ from the primary. We estimate a distance of 34.2 pc for the white dwarf with an error of 20% using the relation of (Oppenheimer et al. 2001). See Table 4 for more details.

UPM 0835-6018C is in a possible triple system with NLTT 19906 and NLTT 19907. The A and B components are separated by 5.1^{′′}. The C component has a separation of 113.0^{′′} at a position angle of 49.3^∘ from the primary. See Table 4 for more details.

UPM 1230-5736AB The A component is estimated to be at 22.2 pc, and has R_{59F} = 12.04 and proper motion per coordinate (μ_α cos δ,μ_δ) = (-227.6,-66.5) mas/yr. NLTT 30961 is found 1.61^′ away, and NLTT lists a red photographic magnitude of 13.1 and proper motion per coordinate (μ_α cos δ,μ_δ ) = (-216.7, -38.2) mas/yr.

The B component is estimated to be at 19.8 pc, and has R_{59F} = 12.83 and proper motion per coordinate (μ_α cos δ,μ_δ ) = (-243.0, -29.3) mas/yr. NLTT 30938 is found 1.68^′ away, and NLTT lists a red photographic magnitude of 12.6 and proper motion identical to NLTT 30961. Thus, this nearby UPM double is likely the same as the NLTT double, but the relatively large offset from the NLTT makes the identification ambiguous.

UPM 1542-5041 is the brightest new HPM discovery from this effort. It has a distance estimate of 33.1 pc, R_{59F} = 9.92 and proper motion per coordinate (μ_α cos δ,μ_δ ) = (182.4, -16.3) mas/yr. NLTT 40903 is found 2.46^′ away, and NLTT lists a red photographic magnitude of 12.8 and proper motion per coordinate (μ_α cos δ,μ_δ ) = (-244.2,-190.8) mas/yr. The discordant magnitudes and proper motions indicate that UPM 1542-5041 is not NLTT 40903.

UPM 1710-5300 has an estimated distance of only 13.5 pc, making it the nearest candidate in the sample.

4.5. COMPARISON TO PREVIOUS PROPER- MOTION SURVEYS

Most previously known HPM stars have been tagged in UCAC3 and their listed proper motions in UCAC3 were taken from their respective catalogs. Because no UCAC3 proper motions were determined, comparisons to other catalogs/surveys are therefore difficult. Nonetheless, within the sky coverage and proper motion regime of this paper, 66 stars have been found in both the Hipparcos and Tycho-2 catalogs that are not tagged as HPM stars in the UCAC3 catalog. This constitutes a small but ample number of stars that can be used to compare the bright end of UCAC3 proper motions to those in the Hipparcos and Tycho-2 catalogs. In Figure 4, we show the comparison between UCAC3 proper motions in RA and DEC to the Hipparcos (top) and Tycho-2 (middle) catalogs. For comparison we also plot the proper motion differences between Hipparcos and Tycho-2 in the bottom panel of Figure 4. This plot implies that for both the Hipparcos and Tycho-2 catalogs the UCAC3 proper motions show only small differences per coordinate at all declinations in the present search, with no significant systematics. The RMS differences of UCAC3 proper motions per coordinate (Δμ_α cos δ, Δμ_δ) when compared to Hipparcos are 7.5 and 6.6 mas/yr, respectively. When compared to Tycho-2 proper motion coordinates we find 5.5 and 5.9 mas/yr, respectively. A slightly lower RMS difference of 3.8 mas/yr in both coordinates is seen when comparing the Hipparcos and Tycho-2 proper motions for these stars.

To investigate fainter stars in UCAC3, we compare UCAC3 proper motions to SPM4 and Super- COSMOS results. We compare proper motions using the SuperCOSMOS proper motions to bring the positions to the UCAC3 epoch with a 1.5 arcsec match radius. A 1.5 arcsec radius was also used to match UCAC3 to SPM4 with no need to correct for proper motions because both catalogs are on the same system and set at the same epoch.

A total of 137 objects meeting the proper motion and declination limits of this paper were found in all three catalogs. In Figure 5, we compare UCAC3 proper motions in the same manner as above with the SPM4 (top) and SuperCOS- MOS (middle) catalogs. Again for comparison, we also include a plot showing the differences between SPM4 and SuperCOSMOS in the bottom panel of Figure 5. The RMS differences between UCAC3 and SPM4 per coordinate (Δμ_α cos δ, Δμ_δ ) are 6.6 and 4.1 mas/yr respectively. Much higher RMS differences of 19.3 and 18.9 mas/yr are seen when comparing UCAC3 to the SuperCOSMOS proper motions per coordinate (Δμ_α cos δ, Δμ_δ ). This comparison also indicates that proper motions in RA are systematically shifted in the Super- COSMOS data, but are consistent in DEC. This high RMS including the systematic shift in RA is also seen when comparing the SPM4 to Super- COSMOS proper motions per coordinate, yielding RMS differences of 19.9 and 17.5 mas/yr in Δμ_α cos δ and Δμ_δ , respectively. The higher RMS differences for the SuperCOSMOS proper motions are in agreement with the findings of TSN18 where SCR proper motions were found to have an average deviation of 23 mas/yr total proper motion when compared to the NLTT and Hipparcos proper motions.

In TSN18 a total of 1662 objects were reported, of which 1615 match the proper motion and declination limits of this paper. During this UCAC3 search, 1298 of the 1615 objects reported in TSN18 were recovered, or a 80.4% succesful recovery rate. Objects missed in this UCAC3 survey are primarily those at the faint end, as the TSN18 survey reached to R_{59F} = 16.5.

The Hipparcos catalog contains 118218 total objects of which 722 meet the proper motion and declination limits of this paper. Tycho-2 contains 2539913 total objects in the main catalog with 1273 of those objects matching the proper motion and declination limits of this paper. We recover 646 Hipparcos stars and 973 Tycho-2 stars using the search criteria of this paper, yielding recovery rates of 89.5% and 76.4% respectively. Objects missed in this UCAC3 survey is primarily due to UCAC3 lacking a source detection for ∼15% of the Tycho-2 objects. The relatively high recovery rates of UCAC3 when compared to these three efforts implies UCAC3 can be used as a reliable source to search for new proper motion stars with μ = 0.18–0.40 arcsec yr^{−1} for other portions of the sky.

5. DISCUSSION

We have found 442 new proper motion systems including 474 objects with 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1} between declinations −90^∘ and −47^∘. In Figure 6, we show the sky distribution for the entire sample reported in this paper. The 474 new discoveries represent a 25.3% increase in new systems for the same region of the sky covered by previous (SCR) searches that used Schmidt plates as the primary source of discovery. While many of these new UPM discoveries are found along the Galactic plane, a region avoided by the SCR survey, additional new systems were found far from the plane. Areas in Figure 6 with a lower density of new discoveries have been heavily searched by previous proper motion surveys as seen when comparing to a similar sky plot presented in TSN18.

As shown in Figure 4 and 5, the proper motions obtained from UCAC3 compare well to the Hipparcos, Tycho-2, and SPM4 catalogs. However, we find that the SuperCOSMOS proper motions have a significantly higher scatter when compared to these catalogs, which confirms our similar result in TSN18.

We find 25 new CPM candidate systems, as well as 31 new subdwarf candidates that will need future spectroscopic efforts to be confirmed. In Figure 7, we show a histogram of the number of proper motion discoveries in 0.^{′′}01 yr^{−1} bins for the present sample, highlighting the number of those having distance estimates within 50 pc. The increase in nearby systems at the lowest proper motions sampled here implies that more nearby stars are likely to be found at even slower proper motion regimes.

Finally, we have found 16 objects in 15 systems with distances estimated to be within 25 pc, and an additional 109 objects in 107 systems between 25 and 50 pc. The discoveries include UPM 1542- 5041, which at R_{59F} = 9.92 is a surprisingly bright new proper motion discovery with an estimated distance of 33.1 pc. UPM 1710-5300, which is our nearest new candidate with an estimated distance at 13.5 pc. We anticipate that further exploration of the UCAC3 for new proper motion discoveries will result in more nearby star candidates, perhaps some even within 10 pc, where new discoveries are still being made (Henry et al. 2006)

We thank the entire UCAC team for making this proper motion survey possible. Special thanks go out to the RECONS team at Georgia State University for their support, John Subasavage in particular for assistance with the SCR searches, and Nigel Hambly for his work with the SuperCOS- MOS Sky Survey. We would also like to thank all USNO summer students who helped in this survey. This work has made use of the SIMBAD, VizieR, and Aladin databases operated at the CDS in Strasbourg, France. We have also made use of data from the Two-Micron All Sky Survey, SuperCOSMOS Science Archive and the Southern Proper Motion catalog.

REFERENCES

Bakos, G. Á., Sahu, K. C., & Németh, P. 2002, ApJS, 141, 187

Deacon, N. R., Hambly, N. C., & Cooke, J. A.

2005, A&A, 435, 363

Deacon, N. R., & Hambly, N. C. 2007, A&A, 468, 163 Deacon, N. R., et al. 2009, MNRAS, 397, 1685

Finch, C. T., Henry, T. J., Subasavage, J. P., Jao, W.-C., & Hambly, N. C. 2007, AJ, 133, 2898

Finch, C., Zacharias, N.,Wycoff, G. 2010, in prep.

for AJ.

Giclas, H. L., Burnham, R., & Thomas, N. G.

1971, Flagstaff, Arizona: Lowell Observatory, 1971

Giclas, H. L., Burnham, R., & Thomas, N. G.

1978, Lowell Observatory Bulletin, 8, 89

Girard, T. et al., paper about NPM (in preparation)

Girard, T. et al. 2010, paper about SPM4 (in preparation)

Hambly, N. C., MacGillivray, H. T., Read, M. A., Tritton, S. B., Thomson, E. B., Kelly, B. D., Morgan, D. H., Smith, R. E., Driver, S. P., Williamson, J., Parker, Q. A., Hawkins, M. R. S., Williams, P. M., Lawrence, A. 2001, MN- RAS, 326, 1279

Hambly, N. C., Irwin, M. J., & MacGillivray, H. T.

2001, MNRAS, 326, 1295

Hambly, N. C., Henry, T. J., Subasavage, J. P., Brown, M. A., & Jao, W. 2004, AJ, 128, 437

Henry, T. J., Subasavage, J. P., Brown, M. A., Beaulieu, T. D., Jao, W.-C., & Hambly, N. C. 2004, AJ, 128, 2460

Henry, T. J., Jao, W.-C., Subasavage, J. P., Beaulieu, T. D., Ianna, P. A., Costa, E., & Méndez, R. A. 2006, AJ, 132, 2360

Høg, E., et al. 2000, A&A, 355, L27

Lépine, S. 2005, AJ, 130, 1247

Lépine, S. 2008, AJ, 135, 2177

Luyten, W. J. 1979, LHS Catalogue (Minneapolis:

Univ. of Minnesota Press)

Luyten, W. J. 1980, Proper Motion Survey with the 48-inch Telescope, Univ. Minnesota, 55, 1 (1980), 55, 1

Oppenheimer, B. R., Hambly, N. C., Digby, A. P., Hodgkin, S. T., & Saumon, D. 2001, Science, 292, 698

Salim, S., & Gould, A. 2003, ApJ, 582, 1011

Scholz, R.-D., Irwin, M., Ibata, R., Jahreiß, H., & Malkov, O. Y. 2000, A&A, 353, 958

Scholz, R.-D., Szokoly, G. P., Andersen, M., Ibata, R., & Irwin, M. J. 2002, ApJ, 565, 539

Subasavage, J. P., Henry, T. J., Hambly, N. C., Brown, M. A., & Jao, W. C. 2005, AJ, 129, 413

Subasavage, J. P., Henry, T. J., Hambly, N. C., Brown, M. A., Jao, W. C., & Finch, C. T. 2005, AJ, 130, 1658

Wroblewski, H., & Costa, E. 1999, A&AS, 139, 25

Zacharias, N., Zacharias, M. I., & Rafferty, T. J.

2000, AJ, 118, 2503 (UCAC1 paper)

Zacharias, N., Urban, S. E., Zacharias, M. I., Wycoff, G. L., Hall, D. M., Monet, D. G., & Rafferty, T. J. 2004, AJ, 127, 3043 (UCAC2 paper)

Zacharias, N., Winter, L, Holdenried, E.R., De Cuyper,J.-P., Rafferty, T.J., Wycoff, G.L., 2008, PASP, 120, 644 (astro-ph 0806.0256)

Zacharias, N. et al. submitted to AJ (UCAC3 release paper)

Zacharias, N. 2010, in preparation for AJ (UCAC3 pixel red.paper)

This 2-column preprint was prepared with the AAS L^ATEX macros v5.2.

Fig. 1.— Color-apparent magnitude diagram for all proper motion systems in the sample having an R_{59F} −J color. New proper motion objects are represented by closed circles while known objects (CPM companions to new objects) are represented with open circles. Data points below R_{59F} = 17 are CPM candidates noticed during the visual inspection.

Fig. 2.— RPM diagram for all proper motion systems in this sample having an R_{59F} −J color. New proper motion objects are represented by closed circles while known objects (CPM companions to new objects) are represented with open circles. The empirical line separates the white dwarf candidate from the subdwarf candidates, which lie above the white dwarf stars and just below the concentration of main sequence stars.

Fig. 3.— Comparison of proper motions per coordinate, μ_α cos δ (top) and μ_δ (bottom), for components in CPM systems. Proper motions from the UCAC3 catalog are represented by closed circles while proper motions manually obtained through other means are denoted by open circles. The solid line indicates perfect agreement.

Fig. 4.— Comparison of UCAC3, Hipparcos and Tycho-2 proper motions per coordinate, Δμ_α cos δ (left column) and Δμ_δ (right column).

Fig. 5.— Comparison of UCAC3, SuperCOS- MOS and SPM4 proper motions per coordinate, Δμ_α cos δ (left column) and Δμ_δ (right column).

Fig. 6.— Sky distribution of all UCAC3 proper motion objects reported in this sample, i.e. those between declinations −90^∘ and −47^∘ having 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1}. The curve represents the Galactic plane.

Fig. 7.— Histogram showing the number of proper motion objects in 0.^{′′}01 yr^{−1} bins for the entire sample (empty bars) and the number of those objects having distance estimates within 50 pc (filled bars).

Table 1 New Proper Motion Systems within 25 Parsecs Based on Distances Using SuperCOSMOS Photographic Magnitudes

Paper Systems References ≤ 25 pc

TSN08 3 (Hambly et al. 2004) TSN10 4 (Henry et al. 2004) TSN12 18 (Subasavage et al. 2005a) TSN15 25 (Subasavage et al. 2005b) TSN18 31 (Finch et al. 2007)

SIPS1 1 (Deacon et al. 2005) SIPS2 12 (Deacon & Hambly 2007)

this paper 15 (Finch et al. 2010)

Table 2 New UCAC3 High Proper Motion Systems between Declinations −90^∘ and −47^∘ with 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1}

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 0000-4843 480848 148604159 181.7 29.9 12.3 8.5 15.579 13.333 11.337 10.824 10.208 10.018 2.509 47.2 UPM 0016-7327 14557586 59575305 184.8 -29.6 1.9 2.1 16.498 15.410 13.572 11.351 10.754 10.611 4.059 40.0 UPM 0028-5501 25583309 125920383 190.0 -10.2 2.6 3.0 17.382 15.533 14.688 11.863 11.233 11.054 3.670 50.1 UPM 0029-6724 26938223 81322056 184.7 43.5 1.8 1.4 15.228 13.197 12.132 11.065 10.412 10.244 2.132 60.7 UPM 0032-6719 29092633 81607463 183.1 90.8 8.9 5.5 17.735 15.518 14.025 12.776 12.160 11.956 2.742 100.6 UPM 0037-6725 33311860 81260513 297.2 -98.6 11.2 11.8 17.318 15.043 13.494 11.529 11.025 10.739 3.514 40.5 UPM 0037-6844 33623179 76513673 249.0 44.0 7.8 7.6 17.173 15.016 13.408 11.571 10.983 10.701 3.445 41.1 UPM 0040-6834 36433102 77158520 170.0 78.5 7.4 7.1 15.386 13.502 12.456 11.054 10.405 10.257 2.448 55.1 UPM 0049-7516 44833770 52993310 141.1 221.6 7.7 7.5 16.132 13.622 11.855 10.558 10.008 9.724 3.064 29.8 UPM 0050-8406 45673415 21181545 184.7 28.1 4.2 3.5 · · · · · · · · · 12.460 11.941 11.665 · · · · · · UPM 0052-7124 47330607 66954257 226.8 54.8 9.0 9.1 16.185 14.764 13.558 12.199 11.642 11.360 2.565 95.3 UPM 0055-8649 50082601 11435834 190.0 3.6 6.0 4.6 16.074 13.915 12.193 11.164 10.594 10.335 2.751 49.1 UPM 0106-6857 60014307 75757311 208.2 -231.6 8.2 8.1 16.704 14.988 14.288 13.229 12.673 12.515 1.759 [181.7] a UPM 0109-7523 62854828 52560670 163.3 -80.0 3.6 6.6 17.846 15.536 13.984 12.662 12.070 11.892 2.874 91.2 UPM 0111-7655B 64567429 47053087 182.5 35.6 4.9 5.0 18.581 16.585 15.107 13.369 12.772 12.531 3.216 109.9 c UPM 0111-7655A 64749501 47075281 130.0 31.4 1.6 1.6 13.499 12.205 11.777 10.781 10.269 10.237 1.424 64.4 c ,d ,e UPM 0116-7214 69103288 63920551 247.5 -77.0 8.7 8.3 16.481 14.783 13.992 13.300 12.745 12.651 1.483 [219.0] a UPM 0118-7606 70334783 49987168 177.9 -34.1 2.4 2.8 17.350 15.149 13.999 13.075 12.395 12.278 2.074 154.5 UPM 0119-7347 71653364 58371207 222.9 28.3 8.7 8.7 17.291 15.254 13.531 12.177 11.624 11.376 3.077 70.0 UPM 0128-4754 79755558 151547143 120.9 -188.5 7.3 7.0 15.375 13.287 11.314 10.210 9.640 9.384 3.077 28.0 f UPM 0133-7503 83912414 53819904 101.6 -180.7 13.0 7.2 18.504 15.996 14.065 12.476 11.886 11.623 3.520 57.3 UPM 0135-6359 86122021 93629302 183.4 -20.8 4.4 10.5 17.836 16.443 15.139 12.260 11.647 11.423 4.183 52.8 UPM 0152-8815 101325332 6293882 193.7 -8.5 12.3 10.5 14.706 13.795 13.226 12.837 12.447 12.357 0.958 173.6 b UPM 0157-7324 106019256 59755191 183.6 -39.7 2.7 2.7 16.972 15.144 14.468 13.599 12.931 12.849 1.545 [230.6] a UPM 0204-5012 112153869 143253073 164.2 97.5 7.5 4.9 16.042 15.107 13.986 11.073 10.552 10.474 4.034 35.7 UPM 0216-5328 123095616 131482914 179.4 102.1 7.5 8.6 13.818 11.862 11.263 10.721 10.127 9.951 1.141 61.6 f UPM 0233-5122 137727579 139047453 259.3 117.5 11.4 11.2 16.907 15.392 14.597 13.798 13.198 12.963 1.594 [234.4] a UPM 0245-8833A 148994471 5191128 174.6 59.1 5.7 5.8 17.617 16.231 · · · 11.828 11.188 10.958 4.403 34.5 c UPM 0245-8833B 149064071 5197674 175.7 89.7 6.5 6.7 · · · · · · · · · 11.726 11.071 10.870 · · · · · · c ,d UPM 0320-4847B 180208650 148355200 208.7 93.3 13.1 12.5 18.877 16.817 15.849 14.740 14.276 14.179 2.077 396.9 c ,d UPM 0320-4847A 180270958 148347787 230.8 147.8 2.4 1.8 15.184 13.008 11.487 10.402 9.856 9.624 2.606 37.7 c ,f UPM 0342-5044 200622342 141302005 165.5 -95.8 16.9 11.6 · · · 12.651 10.850 10.259 9.607 9.376 2.392 36.5 UPM 0350-5947 207350403 108760589 159.8 -161.7 8.5 15.4 18.166 15.461 14.618 11.923 11.380 11.139 3.538 46.8 UPM 0352-7409 209621476 57009023 149.8 117.9 4.0 2.8 15.983 13.991 12.806 11.522 10.892 10.664 2.469 64.5 UPM 0356-7246 212775775 62017326 108.8 143.5 4.5 6.3 16.730 14.913 13.075 11.703 11.059 10.844 3.210 53.1 UPM 0418-6900 232848877 75566269 -227.1 -181.1 7.4 6.7 13.503 11.465 10.434 10.362 9.721 9.505 1.103 52.4 f UPM 0422-5114 236677358 139530080 -162.2 -140.7 8.8 8.3 16.833 14.644 12.724 11.870 11.292 11.042 2.774 67.8 f UPM 0424-6956 238195953 72180172 163.8 167.3 9.5 9.3 17.246 15.106 13.055 12.101 11.530 11.247 3.005 67.9 UPM 0426-7849 239769264 40214583 76.8 163.5 3.7 3.8 16.767 15.569 14.214 11.418 10.732 10.572 4.151 37.0 UPM 0435-8142 248223169 29825780 187.1 31.6 2.9 2.7 13.762 11.941 10.621 11.028 10.406 10.195 0.913 66.4 b UPM 0437-7232 249681505 62832156 104.8 -167.1 2.8 2.8 18.041 14.183 16.621 12.016 11.365 11.131 2.167 63.8 UPM 0443-5236 254948887 134592463 105.7 176.7 5.5 8.2 15.377 13.074 11.399 10.479 9.914 9.640 2.595 37.2 UPM 0445-6544 257096346 87304149 44.6 180.0 10.0 8.2 14.420 12.835 11.824 11.819 11.202 11.025 1.016 107.8 b UPM 0447-6445 259144878 90863676 116.5 159.1 4.0 4.0 15.524 13.123 12.514 11.705 11.063 10.906 1.418 94.7 UPM 0450-4940 261002744 145179168 163.5 -171.0 6.5 7.2 14.913 12.696 10.703 10.194 9.593 9.368 2.502 35.2 UPM 0457-4802 267813979 151048953 17.4 183.0 2.2 2.6 16.158 14.093 12.076 11.516 10.905 10.682 2.577 64.4 UPM 0458-6741 268276278 80291179 83.7 171.0 2.2 2.2 13.851 12.481 11.923 10.275 9.692 9.502 2.206 37.7 UPM 0459-6824 269511253 77743694 133.3 -126.8 9.4 9.6 16.915 14.914 13.406 12.577 11.963 11.699 2.337 111.7 UPM 0510-4952 279040730 144454421 106.3 168.2 7.4 7.3 16.569 14.203 11.922 11.062 10.487 10.257 3.141 39.8 UPM 0514-7456 283007084 54221478 -145.8 -151.0 3.7 3.3 16.945 15.205 14.128 12.800 12.226 12.059 2.405 134.2 UPM 0514-4902 283498019 147437611 -86.8 -199.5 13.2 13.8 18.404 16.620 15.186 12.623 12.056 11.782 3.997 60.3 UPM 0518-4934 286357991 145552843 15.9 -229.9 10.3 10.2 17.480 15.481 13.494 12.173 11.596 11.361 3.308 63.4 UPM 0521-5227 289705231 135166103 118.5 188.5 9.2 8.8 16.471 14.343 12.654 11.384 10.771 10.520 2.959 47.9 UPM 0530-5423 297516602 128202518 162.1 -84.6 2.9 2.9 16.901 14.944 14.172 13.686 13.098 13.000 1.258 [264.7] a UPM 0533-5210A 300341870 136155536 -80.5 180.7 3.4 3.3 16.348 13.641 12.161 11.350 10.762 10.512 2.291 58.2 c UPM 0533-5210B 300345900 136148200 · · · · · · · · · · · · · · · · · · · · · 13.885 13.311 13.020 · · · · · · c ,d UPM 0537-4924 303746224 146154602 196.2 42.2 9.1 9.0 16.734 14.567 12.263 11.299 10.787 10.488 3.268 43.7 UPM 0538-5313 304573280 132361506 244.6 90.0 7.4 7.2 16.220 14.231 12.810 12.202 11.640 11.450 2.029 114.2 UPM 0546-8356 311935231 21813762 39.8 185.9 12.9 12.9 16.962 15.380 13.325 12.060 11.498 11.219 3.320 65.3 UPM 0546-7124 312294377 66931727 -55.1 -176.9 6.1 6.2 16.395 15.073 13.380 11.792 11.285 11.011 3.281 63.8 UPM 0550-4839 315022816 148809418 55.3 283.7 13.2 11.2 14.508 12.328 10.676 10.576 10.015 9.769 1.752 54.7 UPM 0550-5557 315113926 122546698 -14.8 208.1 16.0 13.7 18.420 16.668 15.148 12.467 11.897 11.602 4.201 51.7 UPM 0552-5648 317640102 119472712 4.3 203.5 12.6 13.3 18.140 16.090 14.761 13.133 12.574 12.362 2.957 114.7 UPM 0553-5014 317828071 143105615 -52.7 -180.0 10.9 10.5 16.940 14.790 12.751 11.813 11.335 11.017 2.977 63.3

Table 2—Continued

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 0554-5009 319442059 143452591 45.4 214.7 10.6 9.7 16.264 14.063 11.271 10.784 10.199 9.890 3.279 33.9 UPM 0555-4932 319998070 145629559 -112.4 213.2 12.6 11.6 17.018 14.941 12.272 11.646 11.058 10.703 3.295 49.1 UPM 0556-7215 321269817 63842657 58.9 176.9 1.4 1.3 12.742 10.698 9.700 9.268 8.590 8.380 1.430 30.5 UPM 0558-5358 322864429 129701481 110.3 -200.4 10.9 10.4 16.171 14.204 12.863 11.834 11.328 11.103 2.370 86.4 UPM 0559-5225 323598169 135295015 120.7 152.6 4.5 4.4 14.532 12.000 10.287 9.628 8.951 8.703 2.372 24.9 UPM 0600-4707 324124205 154347926 3.0 223.7 8.9 8.7 16.447 14.358 12.375 11.194 10.635 10.374 3.164 42.5 UPM 0602-6209 326452097 100243766 -57.4 171.1 1.9 1.9 16.507 14.476 12.695 11.805 11.198 10.993 2.671 71.0 UPM 0604-5054 327760875 140727784 179.0 32.7 2.6 2.6 14.600 12.440 10.549 10.265 9.659 9.444 2.175 41.6 UPM 0606-5342 329823432 130660944 141.7 125.4 13.6 11.9 17.659 15.758 14.102 13.026 12.523 12.269 2.732 129.6 UPM 0606-6524 329873509 88555612 -27.1 182.5 7.3 7.4 17.434 15.078 13.889 12.288 11.747 11.522 2.790 78.8 UPM 0606-4907 330128370 147129405 -85.7 165.2 16.3 15.9 17.839 15.654 13.470 12.532 11.980 11.747 3.122 82.3 UPM 0607-5751 330761393 115683690 -96.8 198.5 11.2 11.2 17.343 15.150 13.871 13.063 12.444 12.293 2.087 157.6 UPM 0608-5301A 331826617 133116470 -131.1 208.6 12.2 10.8 14.341 12.234 10.865 10.046 9.431 9.217 2.188 37.1 c UPM 0612-5326 335637420 131623962 -167.4 -72.7 3.4 2.2 16.044 13.982 12.129 11.044 10.486 10.207 2.938 43.6 UPM 0619-4901 341823528 147490465 109.8 221.9 7.2 7.0 14.297 12.153 10.008 9.639 9.010 8.813 2.514 27.5 UPM 0621-6111 343586117 103726637 11.4 204.6 5.8 5.3 16.108 14.256 12.028 10.427 9.788 9.534 3.829 21.8 UPM 0632-6656 353475538 82985482 -29.6 183.3 2.2 2.2 14.698 12.495 10.749 10.165 9.563 9.315 2.330 36.6 UPM 0636-6639 356884852 84035552 -4.4 183.9 3.4 3.3 16.255 14.246 11.945 11.030 10.411 10.135 3.216 38.2 UPM 0636-7412 357254645 56842839 -163.8 92.9 5.9 3.9 16.355 14.629 13.026 12.345 11.740 11.537 2.284 112.5 UPM 0638-5827 358555223 113559044 200.5 -149.5 10.9 11.0 16.676 15.164 14.461 13.562 13.096 12.873 1.602 [228.9] a UPM 0639-6849 359685140 76237418 -40.9 182.9 8.3 8.1 16.409 14.289 12.750 11.592 11.026 10.812 2.697 63.0 UPM 0642-5012 362591504 143221516 -20.5 239.7 7.3 7.2 15.084 13.703 13.051 12.763 12.317 12.141 0.940 159.9 b UPM 0644-7317 363638069 60127410 -10.7 183.8 3.7 4.4 17.367 15.430 13.466 11.932 11.319 11.023 3.498 49.0 UPM 0646-5452 365990094 126421377 10.4 -216.8 22.1 49.6 15.711 13.616 11.583 10.954 10.325 10.078 2.662 46.4 UPM 0649-5354 368443271 129948539 69.8 187.0 10.0 14.3 15.012 12.792 11.410 10.767 10.160 9.939 2.025 54.2 UPM 0659-7648 377784601 47493923 33.0 185.0 6.8 6.8 17.668 15.759 13.416 11.619 10.982 10.658 4.140 31.2 UPM 0711-5513 387967786 125160489 -96.5 152.0 3.8 4.1 15.809 13.727 11.903 11.249 10.650 10.391 2.478 57.9 UPM 0713-5836 390581091 113012021 -35.9 179.8 2.8 2.8 16.176 14.017 12.046 11.214 10.605 10.354 2.803 48.8 UPM 0720-5237 396383525 134568885 113.9 -148.2 4.8 4.3 17.373 15.353 14.468 13.853 13.216 13.056 1.500 [261.7] a UPM 0730-7501 405560351 53890475 -49.5 197.9 27.9 11.2 17.706 16.172 14.101 12.401 11.822 11.539 3.771 61.3 UPM 0731-6642 406499377 83824278 -130.0 127.8 2.5 2.4 12.675 10.861 10.080 9.856 9.195 9.011 1.005 41.9 b UPM 0731-7942 406797553 37071878 -85.3 164.1 7.2 9.1 14.558 12.750 12.113 11.162 10.523 10.366 1.588 64.9 UPM 0734-7509 409044755 53455762 -54.3 192.3 13.2 14.5 17.118 14.957 13.044 12.194 11.614 11.305 2.763 76.6 UPM 0739-8840 413322282 4758933 -114.4 254.0 10.6 10.0 16.884 14.766 · · · 11.015 10.452 10.159 3.751 26.7 UPM 0740-5408 414078074 129084313 -168.2 -76.0 8.3 8.5 13.856 12.626 11.970 11.557 11.021 10.927 1.069 89.1 f UPM 0740-5207A 414137868 136369560 -37.7 -221.5 10.4 9.6 17.906 16.477 14.997 11.898 11.292 11.058 4.579 38.9 c UPM 0740-5207B 414151948 136382302 6.6 -240.0 13.8 13.8 18.475 18.193 17.723 · · · · · · · · · · · · · · · c ,d ,g UPM 0747-6428 421129780 91870083 29.4 178.6 2.5 1.5 13.799 12.892 12.476 11.735 11.361 11.290 1.157 104.9 b UPM 0759-6658 431215147 82902895 5.2 191.4 11.6 12.5 18.734 16.654 15.144 12.797 12.223 11.967 3.857 64.1 UPM 0800-7205 432654941 64470732 -24.8 248.1 9.0 9.0 16.397 14.513 12.843 11.533 10.958 10.703 2.980 55.0 UPM 0802-4926 434306031 146007969 -196.5 -35.5 10.6 11.4 15.982 14.237 12.336 11.304 10.766 10.531 2.933 55.3 UPM 0803-4955 435307518 144246351 -118.6 166.7 3.1 3.1 14.957 14.873 12.586 12.535 11.880 11.774 2.338 113.3 UPM 0806-5903 437482203 111417097 -85.0 163.4 5.8 5.7 16.791 14.877 13.182 11.872 11.273 11.018 3.005 62.1 UPM 0806-5409 437729739 129055037 -221.3 255.4 9.8 12.6 17.265 15.305 13.290 12.030 11.507 11.211 3.275 61.4 UPM 0807-6913 438748524 74797001 157.4 107.6 7.9 6.0 13.404 11.430 10.211 9.541 8.878 8.692 1.889 32.8 f UPM 0811-6952 442531801 72439872 19.1 -197.6 10.7 9.7 15.543 13.944 12.225 11.181 10.610 10.349 2.763 55.2 UPM 0815-4941 445774778 145093080 -149.8 129.7 1.3 1.3 13.306 11.518 10.737 9.978 9.406 9.237 1.540 44.5 UPM 0823-4700 453122494 154795726 184.3 -18.9 4.3 4.3 13.960 11.819 10.807 10.855 10.213 10.058 0.964 68.2 b UPM 0834-4832 463092742 149223005 -40.8 178.8 1.9 1.8 15.441 13.279 11.683 11.452 10.788 10.558 1.827 76.6 UPM 0835-8332 463882202 23233252 -74.5 169.3 2.9 6.9 14.641 12.652 11.481 10.870 10.329 10.130 1.782 66.7 UPM 0835-6716 463888892 81802666 -146.1 194.8 7.9 7.5 18.175 16.354 14.711 11.834 11.286 11.017 4.520 35.1 UPM 0835-7247 464095507 61975334 -61.3 170.1 7.2 2.2 17.097 15.168 13.609 12.364 11.820 11.586 2.804 89.5 UPM 0835-6418 464128846 92464726 -91.0 165.1 7.9 8.0 16.860 15.270 14.489 13.616 12.988 12.838 1.654 [217.3] a UPM 0835-6018C 464201386 106885496 -184.6 -17.7 8.9 11.2 · · · 15.671 13.904 12.162 11.608 11.318 3.509 50.3 c ,e UPM 0837-6435B 465804750 91491299 -29.6 158.4 5.8 6.0 18.701 16.753 14.850 13.323 12.829 12.561 3.430 106.6 c ,d ,e UPM 0837-6435A 465826276 91489399 -46.7 175.2 4.2 3.1 18.204 16.568 14.644 12.203 11.658 11.455 4.365 46.0 c UPM 0838-4935 466900627 145482276 -191.0 -39.4 5.9 6.0 15.071 13.044 11.663 11.255 10.658 10.491 1.789 77.9 UPM 0846-7345B 473694134 58464369 -125.4 112.9 3.0 3.3 15.708 13.930 12.802 11.789 11.205 10.965 2.141 88.4 c ,d ,e UPM 0846-7345A 473701026 58488516 -129.3 127.6 2.9 3.1 15.702 13.617 12.348 11.330 10.710 10.430 2.287 61.6 c UPM 0847-5952 474714326 108445130 -76.0 164.0 4.4 3.2 17.254 15.190 13.486 12.638 12.063 11.818 2.552 108.7 UPM 0847-6114 475060646 103508456 -139.5 113.8 6.7 6.4 17.554 15.670 13.833 13.069 12.548 12.297 2.601 140.6 UPM 0849-5624 476802766 120928221 183.9 -34.2 17.1 5.4 17.324 15.253 13.668 12.312 11.730 11.476 2.941 76.2 UPM 0850-5609 477752730 121836946 -89.3 161.7 2.2 8.1 17.705 16.336 14.428 11.673 11.054 10.899 4.663 34.1 f UPM 0853-7257 480561006 61351874 -163.1 85.0 7.7 6.9 16.464 14.521 12.993 11.935 11.315 11.091 2.586 76.8

Table 2—Continued

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 0855-7628 481940284 48709869 -169.7 64.5 5.7 7.8 17.305 15.711 14.140 12.948 12.418 12.193 2.763 130.1 UPM 0856-7737 483109280 44538257 -80.3 233.0 3.4 3.4 16.221 15.091 13.332 11.754 11.121 10.873 3.337 59.1 UPM 0857-5644 484130611 119756593 -62.0 -187.2 3.5 3.5 15.015 13.200 12.269 11.960 11.492 11.223 1.240 117.2 UPM 0900-7548 486663656 51069120 -269.7 63.8 16.1 10.5 16.230 15.592 13.725 12.571 12.029 11.820 3.021 116.2 UPM 0901-6526 487375530 88399668 -68.4 196.4 6.7 6.7 16.269 14.219 11.471 10.140 9.589 9.282 4.079 18.0 UPM 0904-5040 489923010 141595163 -148.7 151.6 11.4 16.0 18.151 16.823 14.978 13.008 12.436 12.204 3.815 86.3 UPM 0904-7300 490461535 61175505 -139.5 115.7 2.0 2.0 16.181 14.199 12.448 11.242 10.623 10.367 2.957 46.2 UPM 0907-7337 492965065 58937692 -128.1 139.1 7.1 7.0 14.938 12.962 11.817 11.052 10.509 10.264 1.910 68.2 UPM 0908-5735 493590843 116658425 -128.8 178.3 14.0 8.7 15.670 15.333 13.381 12.791 12.208 11.987 2.542 118.8 UPM 0912-5501 497648346 125899556 -181.5 88.6 4.0 4.2 15.179 14.259 11.439 11.944 11.395 11.177 2.315 77.1 b UPM 0913-6058 497794860 104510459 23.8 -189.1 2.6 2.3 13.487 12.365 10.861 11.696 11.171 10.908 0.669 94.0 b UPM 0913-6333 497821252 95208293 -176.3 -65.2 7.4 7.1 16.840 15.043 14.283 13.665 13.160 12.915 1.378 [251.0] a UPM 0913-5405 497914131 129246075 129.3 -163.0 9.6 9.6 16.199 15.920 12.810 12.957 12.365 12.123 2.963 98.0 b UPM 0915-5930 500081336 109741135 101.1 195.8 10.8 10.7 · · · 15.704 · · · 14.063 13.562 13.349 1.641 [313.3] a ,b UPM 0915-5515 500370580 125053511 107.8 -182.2 6.5 6.8 15.996 14.231 11.880 11.645 10.957 10.736 2.586 68.9 UPM 0917-4707 501408590 154348882 -175.8 -171.2 3.6 3.0 15.396 13.501 11.295 10.304 9.806 9.544 3.197 31.0 f UPM 0919-6205 503552308 100495615 204.0 52.6 7.1 7.0 15.583 13.720 11.948 11.703 11.070 10.854 2.017 87.2 UPM 0924-7319 507837850 60043020 -173.0 76.6 5.2 5.3 18.285 16.869 15.047 12.394 11.906 11.604 4.475 50.5 UPM 0927-4925 510592049 146043500 -226.1 68.0 7.0 7.0 19.157 19.607 20.120 · · · · · · · · · · · · · · · d ,g UPM 0928-5442A 511346324 127068710 -129.4 137.3 6.3 6.1 14.539 12.199 10.397 10.702 10.072 9.849 1.497 57.1 c UPM 0928-5442B 511392300 127069700 -91.0 147.9 7.5 7.8 20.410 18.880 16.134 14.150 13.607 13.295 4.730 93.0 c ,d ,e ,h UPM 0928-4736 511977850 152615832 -151.2 132.9 4.0 6.7 18.129 16.786 14.890 12.509 11.889 11.664 4.277 55.1 UPM 0931-5214 514422292 135948112 -182.9 -46.6 3.4 4.3 14.343 12.375 11.129 11.335 10.735 10.499 1.040 77.0 b UPM 0934-8226 516828159 27228505 -134.3 124.9 3.5 3.4 17.326 15.196 13.416 12.173 11.634 11.357 3.023 70.1 UPM 0946-5721 527727964 117517068 194.4 -6.3 12.3 7.3 15.794 13.902 12.640 12.623 11.989 11.810 1.279 [150.9] a UPM 0948-5807 529927201 114732425 -249.0 161.6 12.8 12.8 16.700 14.743 12.547 12.154 11.639 11.406 2.589 93.8 UPM 0948-4840 530079096 148753388 -172.0 55.8 2.9 5.1 14.042 12.832 12.555 12.466 12.030 11.933 0.366 150.0 b UPM 0952-5004 532988430 143714640 144.1 122.4 4.0 4.0 16.780 13.537 13.458 12.811 12.163 11.957 0.726 144.6 UPM 0952-5404 533479000 129344116 33.5 -262.1 9.7 9.5 14.935 12.574 10.116 9.993 9.324 9.098 2.581 29.0 UPM 0959-6511 539778440 89339446 -229.7 47.3 9.2 9.3 16.281 15.042 13.103 11.857 11.317 11.117 3.185 72.6 UPM 1001-7450 540996018 54585231 -49.3 175.2 3.7 4.2 17.005 15.147 12.911 11.181 10.596 10.296 3.966 29.3 UPM 1002-5346 542138816 130406875 -211.8 85.4 14.4 15.3 17.471 15.616 13.425 12.588 12.082 11.881 3.028 100.0 UPM 1004-7143 543907730 65807409 -154.7 107.0 1.5 3.0 13.698 11.777 10.860 9.849 9.238 9.066 1.928 38.7 UPM 1007-5654 546325232 119102081 -178.0 66.5 4.5 4.6 17.079 15.025 13.362 12.746 12.177 11.925 2.279 128.2 UPM 1015-6848 554027327 76286632 -183.1 40.0 7.4 7.6 16.784 14.899 13.950 12.921 12.309 12.085 1.978 152.7 UPM 1016-5354 554981277 129915776 153.2 -120.3 4.5 4.4 16.038 14.239 13.999 13.325 12.707 12.543 0.914 165.2 b UPM 1016-8230 555178676 26962130 -242.7 49.6 12.4 10.6 17.666 15.813 14.179 12.622 12.006 11.790 3.191 81.9 UPM 1018-5540 556901250 123585233 -231.3 106.5 7.2 6.9 15.108 12.714 10.596 10.142 9.605 9.313 2.572 32.7 f UPM 1020-5039 558143896 141657641 -273.1 156.0 5.5 5.5 15.783 13.462 11.592 10.903 10.321 10.093 2.559 47.0 UPM 1024-5014 561747625 143139523 -254.2 35.8 8.2 7.6 17.315 15.265 13.224 12.364 11.820 11.647 2.901 89.7 UPM 1025-6853 563154280 76012205 -232.9 -54.0 8.2 7.7 16.338 14.232 12.254 10.835 10.243 9.967 3.397 30.8 UPM 1026-5220 563859528 135555177 -142.7 145.1 18.7 18.7 15.783 13.573 11.631 10.719 10.224 9.928 2.854 39.7 UPM 1029-4717 566272965 153747533 -191.1 78.1 31.5 9.0 18.142 16.158 14.562 13.301 12.824 12.561 2.857 137.8 UPM 1029-5833 566322949 113212773 -140.3 145.3 4.5 4.5 15.877 13.186 11.789 11.224 10.638 10.395 1.962 63.3 UPM 1030-5522 567848867 124674624 -170.2 72.1 13.8 12.0 16.693 14.689 12.425 11.484 10.849 10.609 3.205 47.6 UPM 1033-5703 570262042 118605552 -199.0 -93.6 11.3 11.5 17.406 15.678 13.149 12.258 11.753 11.469 3.420 72.1 UPM 1034-5524 571158773 124522000 -197.0 -21.6 6.0 6.0 14.270 12.104 10.735 10.789 10.171 10.007 1.315 64.3 b UPM 1037-7107 574194223 67973139 -209.1 -.1 8.2 8.4 17.147 15.246 13.842 12.789 12.274 12.049 2.457 130.5 UPM 1039-6147 575499606 101537935 -197.4 64.0 7.1 7.2 16.967 14.621 12.133 11.414 10.764 10.531 3.207 44.0 UPM 1039-4757 575999373 151362747 -172.1 67.6 6.3 4.7 18.025 15.870 13.756 12.701 12.107 11.823 3.169 81.3 UPM 1040-5621 576632314 121134540 -173.7 61.3 13.3 13.3 16.539 15.734 14.579 13.989 13.397 13.205 1.745 [259.3] a ,h UPM 1040-5728A 576899309 117072931 -151.4 131.1 5.1 5.9 17.195 15.395 13.254 12.448 11.828 11.607 2.947 88.8 c UPM 1040-5728B 576912600 117071399 -224.2 138.9 5.2 5.6 18.382 16.178 13.855 13.298 12.732 12.435 2.880 164.7 b ,c ,d ,h UPM 1041-5743 576937649 116163103 -162.2 140.3 6.8 6.9 16.863 14.599 12.833 11.986 11.468 11.254 2.613 80.4 UPM 1044-7053A 580394596 68773915 -217.5 17.6 7.3 7.4 16.376 14.437 12.659 11.564 10.952 10.724 2.873 57.8 c UPM 1044-7053B 580396649 68739099 -217.5 36.5 8.4 8.5 20.085 17.841 15.418 13.843 13.250 12.957 3.998 92.3 c ,d UPM 1049-5024 584145300 142551809 -177.3 -56.6 4.8 4.4 17.250 15.168 13.358 11.933 11.301 11.067 3.235 54.6 UPM 1051-6453 586032816 90413577 -182.4 85.1 7.4 6.8 16.646 15.014 13.501 12.117 11.566 11.333 2.897 80.9 UPM 1053-6848 587914658 76268649 100.5 167.3 5.2 5.3 15.903 14.550 13.447 13.255 12.751 12.637 1.295 [218.7] a ,b UPM 1054-5945 588842452 108899458 -244.9 52.1 8.8 9.4 17.515 15.478 13.363 12.059 11.462 11.212 3.419 55.7 UPM 1055-5934 590266470 109511211 -217.8 99.6 7.3 7.3 17.227 14.861 12.711 11.615 10.974 10.715 3.246 44.7 UPM 1056-5750 590521836 115757473 -194.4 121.9 6.9 7.4 17.175 14.966 12.873 11.339 10.727 10.450 3.627 33.7 UPM 1057-5048 591643375 141061116 -116.6 164.1 3.8 3.8 16.024 12.974 11.947 11.375 10.766 10.567 1.599 72.8 UPM 1058-5516 592209732 125011151 -57.8 204.2 4.5 4.5 · · · · · · · · · 13.132 12.615 12.357 · · · · · ·

Table 2—Continued

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 1100-6615 594036873 85493226 181.0 -6.1 40.0 7.8 19.612 14.988 17.336 13.231 12.665 12.383 1.757 97.0 UPM 1101-6112 595586097 103635531 -184.4 62.3 6.7 7.2 16.499 14.183 12.383 11.977 11.450 11.232 2.206 92.8 UPM 1101-6918 595737805 74472734 -170.1 78.2 9.4 5.4 15.700 15.057 13.623 13.080 12.398 12.229 1.977 153.7 UPM 1104-6232 598106935 98845495 -207.8 -58.5 6.0 6.2 16.423 14.086 11.484 10.256 9.677 9.357 3.830 19.4 UPM 1104-7107A 598372077 67942248 -197.3 -83.8 7.7 7.7 17.740 16.102 14.741 12.287 11.770 11.545 3.815 60.9 c UPM 1104-7107B 598388051 67951710 20.3 23.1 3.5 5.9 15.524 13.595 15.033 12.855 12.444 12.183 0.740 44.6 b ,c ,d ,e UPM 1105-5825A 598956034 113681441 -176.1 51.5 4.2 4.2 16.916 · · · 13.713 10.298 9.711 9.496 · · · 15.2 c ,h UPM 1105-5825B 599009180 113697850 -141.8 56.9 12.4 6.6 17.721 15.259 13.109 11.615 11.070 10.796 3.644 38.4 c ,d ,e UPM 1107-7032 600625006 70069523 -192.8 134.6 4.8 3.5 15.169 13.238 11.793 11.129 10.513 10.258 2.109 63.5 UPM 1109-8518 602953600 16907251 -189.7 35.3 3.1 3.1 16.926 14.899 13.318 11.652 11.113 10.801 3.247 49.0 UPM 1111-6653 604096236 83206908 -182.5 13.6 7.1 6.9 17.073 15.007 13.596 12.187 11.629 11.392 2.820 77.9 UPM 1111-6014 604347021 107105218 -195.7 52.2 5.3 5.3 17.103 14.488 11.285 12.775 12.171 11.959 1.713 121.4 UPM 1111-5903 604421714 111381636 -144.2 109.1 3.9 16.3 14.777 12.424 10.606 11.144 10.541 10.293 1.280 72.3 UPM 1112-4834 605254455 149144350 -245.3 106.6 10.1 10.0 18.765 16.634 14.154 11.953 11.352 11.035 4.681 28.8 UPM 1112-5246 605337027 134015761 -33.2 -181.6 3.7 3.3 17.313 14.887 13.078 12.705 12.109 11.844 2.182 119.1 UPM 1112-5551 605392402 122918291 -212.5 67.0 7.9 6.0 14.114 11.879 10.866 11.008 10.356 10.182 0.871 71.0 b UPM 1113-4908 605758353 147100509 -196.7 32.0 6.8 6.8 15.399 14.112 13.662 12.671 12.164 12.048 1.441 [147.3] a UPM 1113-5546 605999181 123199403 -174.7 56.3 3.2 3.1 15.809 13.571 11.484 11.180 10.589 10.304 2.391 56.2 UPM 1120-7753 612430190 43574189 -178.5 38.5 3.0 3.4 16.632 14.920 13.758 12.063 11.388 11.134 2.857 70.1 UPM 1122-4916 613897272 146609505 -184.2 34.4 6.1 9.6 17.581 15.504 13.135 12.255 11.714 11.483 3.249 71.7 UPM 1122-7946 614301816 36791042 -181.4 35.5 2.8 3.0 15.309 13.424 12.158 11.101 10.526 10.224 2.323 57.7 UPM 1123-4839 615142692 148852167 -181.3 83.0 3.7 3.7 · · · · · · · · · 11.281 10.698 10.362 · · · · · · UPM 1125-5127 616862846 138732194 170.6 147.4 4.5 4.5 17.136 13.432 13.395 12.728 12.159 11.930 0.704 129.5 UPM 1134-6455 625214057 90272065 -186.6 2.3 4.5 10.5 14.941 12.946 11.645 10.527 9.953 9.681 2.419 42.6 UPM 1135-5554 625712836 122753701 -200.8 -116.8 18.5 9.4 15.127 13.022 11.497 11.248 10.698 10.497 1.774 77.7 UPM 1136-5358A 626495784 129716980 -215.3 -74.1 6.9 6.7 14.772 12.473 10.510 10.206 9.574 9.302 2.267 36.3 c ,f UPM 1136-5358B 626496300 129732900 -247.7 -69.6 6.6 6.4 19.322 18.182 17.904 · · · · · · · · · · · · · · · c ,d ,g ,h UPM 1142-6440 632248846 91165839 -183.4 -205.1 32.2 16.8 16.067 14.081 11.418 10.393 9.846 9.481 3.688 23.7 UPM 1142-6344 632535830 94528424 -259.0 40.0 7.5 7.3 15.965 13.490 10.971 11.583 10.985 10.800 1.907 72.0 UPM 1143-5324 632832624 131734543 -188.4 120.7 2.9 18.4 13.722 11.666 10.146 10.058 9.463 9.242 1.608 45.1 f UPM 1143-4836 633486209 149024797 -119.3 165.6 3.1 3.1 15.959 13.889 12.573 12.733 12.228 12.000 1.156 [155.7] a ,b UPM 1144-4923 633657394 146191433 -277.6 -16.1 8.4 8.1 15.894 13.774 12.050 11.847 11.229 11.032 1.927 93.9 UPM 1144-5557 633896464 122551085 -245.2 37.0 7.1 7.1 17.383 15.306 13.222 12.097 11.538 11.266 3.209 63.3 UPM 1147-4733 636701757 152783368 -206.3 126.8 11.3 11.3 17.985 15.817 13.616 12.055 11.537 11.254 3.762 48.0 UPM 1149-7948 638766897 36660917 -203.2 38.5 10.4 10.4 16.103 15.183 14.614 13.205 12.729 12.637 1.978 159.8 f UPM 1152-4906 641000199 147194325 190.9 10.2 8.4 8.3 · · · · · · · · · 11.818 11.247 10.996 · · · · · · UPM 1157-4902 645382627 147472855 -182.0 -5.2 5.0 6.4 17.658 15.389 13.655 12.831 12.271 12.048 2.558 116.8 UPM 1158-4740 646653103 152372902 -188.8 35.4 6.9 7.9 17.845 16.206 14.692 12.675 12.074 11.872 3.531 77.2 UPM 1200-6048 648207506 105083449 -179.9 32.5 3.6 15.0 14.999 12.193 10.693 11.014 10.469 10.258 1.179 70.1 f UPM 1201-6030 648904878 106182272 -184.4 -14.8 6.3 6.3 17.271 15.315 12.937 12.251 11.654 11.423 3.064 76.7 UPM 1203-4910B 651090352 146962333 -177.1 -40.5 4.2 4.2 15.446 13.202 11.735 11.692 11.124 10.914 1.510 97.5 c UPM 1204-7506 651612980 53600108 -265.4 48.9 6.7 6.6 15.549 13.867 12.272 10.779 10.221 9.999 3.088 39.8 f UPM 1208-6352 655915161 94051538 -180.8 11.6 3.9 3.9 12.899 10.962 10.047 11.126 10.510 10.283 -0.164 81.3 b ,h UPM 1210-5144 657807554 137758940 -175.3 64.4 7.0 10.8 12.323 10.599 9.736 10.203 9.530 9.365 0.396 55.3 b UPM 1211-5740 658107210 116377531 -72.8 167.5 10.9 8.5 17.816 16.003 14.320 13.537 12.989 12.756 2.466 183.9 UPM 1211-4738 658674798 152461987 -186.6 18.1 2.8 2.8 17.353 15.654 14.772 13.855 13.243 13.044 1.799 [237.7] a UPM 1218-5642 664279147 119833488 -181.2 -13.0 8.0 7.9 15.224 13.229 11.622 10.975 10.407 10.178 2.254 58.6 UPM 1219-5935 665312081 109493550 -182.5 139.5 4.2 4.1 16.132 15.777 13.703 12.731 12.174 11.938 3.046 93.9 UPM 1219-5639 665642490 120010019 -214.6 8.3 7.1 7.0 17.522 15.398 14.005 11.404 10.748 10.520 3.994 31.0 UPM 1221-5118 667250601 139300531 -239.0 -102.7 8.5 9.0 16.943 15.688 13.803 12.740 12.240 12.037 2.948 123.3 UPM 1221-5305 667280397 132879517 181.8 -132.5 3.6 3.6 14.393 12.853 11.881 12.836 12.249 12.091 0.017 188.7 b ,h UPM 1224-5429 669796204 127850432 -181.6 7.1 4.1 4.1 16.525 14.619 13.884 12.922 12.232 12.096 1.697 164.0 UPM 1224-5909 669916109 111047246 -194.8 -52.8 3.4 3.4 14.920 13.632 11.792 11.702 11.073 10.887 1.930 87.2 UPM 1227-6342 672319589 94676890 174.5 -44.9 4.6 12.5 16.333 14.224 12.635 12.742 12.210 12.039 1.482 161.6 UPM 1228-5146 673673311 137589485 -190.6 -17.4 8.3 5.3 17.393 15.609 13.787 12.722 12.165 11.925 2.887 105.2 UPM 1229-5139 674128500 138032073 -239.8 -122.1 7.4 7.3 13.836 13.582 13.083 12.724 12.372 12.235 0.858 165.5 b UPM 1229-6033 674141823 105973539 -183.9 2.6 7.0 7.1 16.974 14.994 13.107 12.440 11.968 11.709 2.554 108.9 UPM 1230-5736B 675249073 116560461 -243.0 -29.3 6.9 6.5 14.928 12.828 10.998 9.694 9.033 8.785 3.134 19.8 c ,f UPM 1230-5736A 675783245 116623954 -227.6 -66.5 6.8 6.5 13.794 12.035 10.550 9.348 8.712 8.445 2.687 22.2 c ,f UPM 1233-5438 678078870 127263281 -67.0 173.0 3.8 3.6 15.403 13.583 12.441 11.565 10.990 10.792 2.018 85.3 UPM 1239-7327 683401087 59573302 -180.1 -29.1 3.0 3.0 16.017 · · · 10.602 10.963 10.328 10.089 · · · 34.6 b ,h UPM 1239-6228 683531021 99084175 212.3 -155.5 8.5 9.1 15.513 15.123 12.290 12.025 11.419 11.185 3.098 78.1 UPM 1240-5637 684685297 120146483 -245.8 -139.0 6.9 6.6 14.348 13.818 12.542 11.489 10.932 10.712 2.329 66.0 UPM 1243-6904 687517359 75354839 -198.3 -76.6 10.6 12.6 17.311 15.316 13.542 12.819 12.303 12.038 2.497 127.2

Table 2—Continued

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 1248-6018 691205255 106888292 187.3 4.1 20.9 13.0 15.923 13.444 11.840 11.311 10.782 10.503 2.133 65.6 UPM 1248-6825 691899930 77658523 -185.0 -39.5 12.1 13.9 14.313 12.883 13.164 11.350 10.656 10.528 1.533 55.7 UPM 1253-5924 696374392 110140798 -177.5 34.4 7.9 3.1 16.438 14.707 12.458 11.271 10.701 10.479 3.436 43.4 UPM 1255-6915 697926133 74668638 -169.2 -109.2 14.1 5.8 15.934 13.804 11.864 10.907 10.350 10.098 2.897 42.2 UPM 1255-5654 698007911 119128301 268.5 -2.5 13.5 13.7 · · · 16.078 14.497 13.044 12.512 12.296 3.034 100.8 UPM 1255-6817 698247493 78148828 -189.8 -34.4 8.6 7.9 16.149 14.011 12.529 11.674 11.108 10.880 2.337 75.9 UPM 1257-5107 699318268 139935108 -167.8 -69.7 7.7 3.3 18.006 16.101 13.909 12.484 11.923 11.683 3.617 66.0 UPM 1259-5144 701235466 137713698 -185.2 1.9 3.2 3.9 17.695 15.716 13.851 12.237 11.649 11.383 3.479 58.2 UPM 1308-5535 709469852 123890378 -213.0 -9.5 7.5 7.9 16.138 14.372 12.622 11.536 10.960 10.704 2.836 60.8 UPM 1308-7437 710077137 55354493 -131.6 -161.3 9.3 7.5 16.086 14.421 12.251 11.514 10.905 10.627 2.907 59.1 UPM 1309-5339 710289427 130807194 -187.7 -9.1 5.2 7.3 17.244 15.525 13.484 12.040 11.427 11.126 3.485 54.7 UPM 1312-5933 712889351 109595597 -223.2 -40.8 7.1 7.4 15.749 14.358 11.945 11.061 10.462 10.186 3.297 43.9 UPM 1317-5100 717471129 140352770 -137.6 117.9 4.3 4.2 17.484 16.767 15.525 13.578 13.062 12.767 3.189 149.2 UPM 1318-6705 718242602 82452844 -196.7 -57.2 8.6 8.7 17.162 15.557 14.570 13.880 13.363 13.041 1.677 [250.1] a UPM 1322-5730 721872886 116945756 -214.6 -67.6 6.5 6.3 15.574 13.935 12.350 11.266 10.699 10.455 2.669 59.6 UPM 1324-7123 724317780 66983446 -188.8 14.7 5.9 3.4 16.176 14.167 12.888 11.975 11.342 11.166 2.192 92.2 UPM 1325-8321 724631438 23929798 -105.5 159.4 2.4 2.8 15.209 13.416 11.780 10.794 10.149 9.925 2.622 45.5 UPM 1330-5844 729060131 112556039 -190.1 22.8 6.3 6.1 15.543 13.370 12.336 11.118 10.468 10.270 2.252 56.7 UPM 1332-7421 731048730 56335255 175.9 50.5 47.8 45.3 14.290 12.439 10.758 10.057 9.483 9.229 2.382 36.9 f UPM 1335-5708 734150978 118269665 -225.3 29.0 13.6 12.7 18.565 17.027 15.200 12.487 11.866 11.592 4.540 46.6 UPM 1339-7507 737590334 53557535 -177.7 -48.5 11.2 14.3 18.288 16.752 14.841 12.737 12.205 11.930 4.015 66.7 UPM 1340-6431 738068289 91682046 -179.2 -44.8 10.0 10.0 14.464 13.006 12.265 10.686 10.098 9.936 2.320 50.7 f ,h UPM 1344-6829 741720593 77453474 -256.9 -180.2 6.8 7.6 17.635 16.274 14.268 11.780 11.185 10.941 4.494 36.3 UPM 1346-6135 743664758 102274414 -199.8 -61.5 8.2 7.1 16.859 14.674 13.054 11.999 11.423 11.173 2.675 73.9 UPM 1354-7121 751408498 67092222 -165.0 -132.7 6.5 6.8 12.598 10.665 8.750 8.549 7.920 7.672 2.116 19.3 UPM 1401-6837 757371795 76964116 -174.5 -56.7 8.8 13.0 16.977 15.882 13.535 12.571 11.991 11.744 3.311 96.0 UPM 1401-6405B 757530750 93309800 -185.2 -149.3 5.8 5.7 19.027 17.453 15.687 13.273 12.699 12.398 4.180 76.3 c ,d UPM 1401-6405A 757555362 93281664 -172.2 -140.9 7.1 7.0 15.536 13.909 12.787 10.296 9.649 9.407 3.613 24.1 c UPM 1403-6140 758976520 101999830 193.6 149.2 10.6 10.6 · · · 13.252 · · · 10.991 10.366 10.174 2.261 55.8 b UPM 1406-5850 761880385 112189733 -175.4 -64.0 4.2 6.6 16.746 15.180 13.568 12.214 11.621 11.380 2.966 80.6 UPM 1407-5749 762455713 115832007 253.6 -52.6 10.0 10.1 17.890 16.185 14.303 13.311 12.795 12.541 2.874 145.1 UPM 1408-6315 763992896 96269737 -167.5 -72.4 5.1 5.3 17.577 16.267 14.705 12.362 11.777 11.517 3.905 60.7 UPM 1412-6959 766992114 72040016 -178.2 -39.7 4.5 4.6 16.912 14.912 14.256 12.205 11.665 11.385 2.707 74.4 UPM 1414-6023A 768913676 106583792 -200.8 -87.5 6.4 6.5 16.109 14.192 12.328 11.739 11.151 10.937 2.453 78.4 c UPM 1414-6023B 768922049 106594300 -189.1 -61.3 4.8 4.7 16.568 17.150 17.718 · · · · · · · · · · · · · · · c ,d ,g UPM 1415-6311 769792263 96488756 -246.7 -29.1 10.4 7.5 17.414 15.880 14.282 11.599 11.016 10.763 4.281 35.7 UPM 1415-5844 770247340 112534141 -142.0 -240.6 7.6 7.7 17.067 15.128 13.915 12.666 12.023 11.801 2.462 110.1 UPM 1416-6547 770760647 87154578 -154.5 97.2 13.3 18.2 16.250 14.702 13.371 11.036 10.461 10.144 3.666 33.6 UPM 1416-6846 770849386 76397755 -182.9 -131.7 5.2 4.0 16.417 15.759 14.404 13.367 12.835 12.591 2.392 154.5 UPM 1418-7605 772902679 50072692 -43.9 -181.7 7.5 9.5 14.643 12.745 11.734 10.339 9.734 9.482 2.406 39.0 f UPM 1419-5109 773453770 139843693 -125.6 -152.6 13.5 5.2 16.238 14.670 13.099 11.961 11.399 11.181 2.709 83.3 UPM 1426-6340 779857214 94764404 -183.5 67.4 6.8 18.1 15.798 14.747 14.011 13.550 13.079 12.941 1.197 [250.9] a ,b UPM 1427-6705 780541416 82481944 -170.3 -110.3 7.2 7.0 16.896 14.891 13.557 12.078 11.543 11.368 2.813 79.4 UPM 1430-7722B 783295650 45468699 -67.0 -44.4 7.3 7.1 20.009 18.111 16.593 15.116 14.488 14.296 2.995 280.6 c ,d ,e UPM 1430-5448 783845768 126695594 -195.4 -111.9 6.9 6.7 16.262 15.582 13.144 12.323 11.716 11.538 3.259 97.6 UPM 1432-6213 785364757 99996107 -149.4 -144.0 6.2 6.3 16.798 15.410 13.136 12.517 11.844 11.615 2.893 98.9 UPM 1433-6149 786022560 101424123 -198.2 -12.9 8.1 6.3 16.961 14.678 13.386 12.504 11.919 11.717 2.174 115.2 UPM 1435-6728 787903652 81063756 -277.5 12.8 7.3 7.1 16.652 14.492 12.999 12.098 11.571 11.368 2.394 93.7 UPM 1436-6144 788585214 101740867 -97.4 -233.3 7.9 8.2 16.174 14.344 13.071 11.855 11.299 11.091 2.489 82.5 UPM 1437-6116 789964428 103381853 123.3 -155.2 9.0 22.6 15.313 13.941 12.227 11.541 10.855 10.665 2.400 75.0 UPM 1439-6433 791205139 91561306 -198.3 -43.0 7.1 7.0 15.121 14.112 13.604 13.110 12.518 12.422 1.002 [171.5] a ,b UPM 1442-5937 793810374 109363585 -166.2 -73.5 5.5 9.3 17.286 15.442 12.698 11.310 10.702 10.454 4.132 30.9 UPM 1442-6702 794095735 82640171 -131.0 -128.7 4.8 5.7 16.827 14.652 12.674 11.716 11.181 10.862 2.936 58.4 UPM 1442-5915 794124307 110687177 -243.6 -222.5 10.8 10.8 17.846 16.231 14.848 13.288 12.736 12.574 2.943 141.4 UPM 1443-6554 795028077 86711555 -183.2 -182.4 7.8 8.6 16.370 14.644 12.681 11.880 11.296 11.000 2.764 73.2 UPM 1448-6357 799625574 93760146 -168.0 -197.1 4.5 4.5 · · · · · · · · · 11.091 10.420 10.275 · · · · · · UPM 1449-5926 800302397 109989509 -171.8 -75.5 7.9 45.0 15.760 14.604 · · · 12.384 11.701 11.583 2.220 108.1 b UPM 1449-6056 800518005 104607864 187.8 58.2 28.3 20.1 14.203 11.948 10.818 10.224 9.608 9.357 1.724 45.2 UPM 1449-5130 800558946 138542514 -207.9 -161.2 7.8 9.0 16.622 15.191 13.019 11.750 11.123 10.926 3.441 55.9 UPM 1452-5459 803454332 126035105 -250.3 -116.9 10.1 10.5 17.452 16.162 14.856 11.426 10.817 10.561 4.736 31.2 UPM 1453-5010 803753281 143395678 -173.6 -91.2 11.2 11.0 18.047 16.525 14.412 13.280 12.689 12.436 3.245 120.3 UPM 1453-7305 803890316 60868008 -21.5 211.7 15.2 15.2 · · · 14.823 · · · 11.052 10.501 10.261 3.771 27.9 b UPM 1454-6013 804616852 107210805 -253.1 -198.5 10.3 8.0 16.823 15.696 13.935 11.618 11.103 10.858 4.078 44.5 UPM 1454-6322 804798590 95867997 -110.5 -151.9 4.7 10.5 14.814 13.233 12.794 11.063 10.436 10.270 2.170 55.3

Table 2—Continued

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 1454-5809 805350729 114653491 -36.4 188.0 13.1 13.1 16.770 14.890 13.200 10.635 10.063 9.776 4.255 20.9 UPM 1455-4904 806346721 147309534 -156.8 -89.2 6.6 6.5 14.785 13.811 11.602 11.580 10.949 10.737 2.231 72.9 UPM 1503-5007B 813027719 143532327 · · · · · · · · · · · · · · · · · · · · · 11.727 11.174 10.921 · · · · · · d ,c UPM 1503-5007A 813028013 143524824 -238.2 -193.2 7.5 7.0 14.234 12.109 10.235 10.655 10.109 9.835 1.454 57.6 c UPM 1511-5319 820599480 132025375 10.6 -179.8 3.5 3.5 16.131 14.364 13.682 11.998 11.430 11.202 2.366 85.4 f UPM 1513-5602 822002567 122233112 -190.6 -97.3 4.3 3.5 15.978 14.268 12.471 11.162 10.617 10.319 3.106 45.7 UPM 1515-6258 823574156 97313936 -190.1 -110.5 9.1 8.2 16.900 16.131 14.793 11.735 11.130 10.852 4.396 35.6 UPM 1515-7325 823782967 59696719 174.0 -189.4 10.1 15.5 17.600 15.781 13.903 12.626 12.141 11.913 3.155 94.0 UPM 1517-5807 826033939 114763609 -188.8 -17.3 7.0 6.9 15.883 14.016 14.209 11.903 11.226 11.088 2.113 73.0 UPM 1519-7255 827454427 61484348 -194.5 -216.5 7.7 7.5 16.426 14.266 11.940 10.898 10.297 9.993 3.368 32.3 UPM 1521-4835 829428454 149044795 -234.3 -146.1 11.3 11.3 17.385 15.988 13.830 12.255 11.683 11.428 3.733 62.1 UPM 1523-4913 831258441 146791866 -94.7 -180.7 8.7 7.9 16.331 14.663 13.027 11.475 10.810 10.588 3.188 48.5 UPM 1523-5454 831355688 126325591 -60.6 200.9 14.9 14.9 17.770 11.791 9.697 9.767 9.194 8.871 2.024 20.4 UPM 1524-5439 831659121 127212227 -187.7 -39.2 7.7 7.9 15.966 14.134 12.376 11.510 10.966 10.751 2.624 68.6 f UPM 1526-4930 833429461 145750882 -154.9 -115.6 8.9 7.9 13.599 11.582 10.794 9.983 9.350 9.177 1.599 43.9 f UPM 1528-5839B 835757400 112820999 5.9 -197.8 6.5 6.5 18.311 18.503 18.776 · · · · · · · · · · · · · · · c ,d ,g UPM 1528-5839A 835780889 112825365 2.1 -197.2 4.2 4.1 15.182 13.233 11.679 10.416 9.777 9.528 2.817 33.3 c UPM 1530-5511 837643179 125327924 -95.1 -153.8 6.9 7.0 15.742 13.925 12.143 11.511 10.875 10.684 2.414 71.3 UPM 1533-6556 840377734 86586399 -148.6 -137.4 7.3 7.4 16.368 14.167 12.510 11.836 11.297 11.026 2.331 81.2 UPM 1537-5610 843606725 121747354 -133.2 -133.6 3.5 3.5 15.275 13.265 11.568 10.839 10.207 10.004 2.426 49.8 UPM 1538-5456 844492903 126230428 -102.9 -207.1 14.3 14.3 17.152 16.178 13.882 12.213 11.678 11.392 3.965 62.1 UPM 1540-5023 846454757 142615035 -229.8 -95.6 8.3 8.0 15.638 14.696 14.199 13.166 12.711 12.579 1.530 [186.4] a UPM 1540-5550 846546026 122995128 -173.8 -262.2 7.9 7.9 15.877 14.542 12.672 11.654 11.053 10.762 2.888 66.5 UPM 1540-6447 846621188 90731820 -153.0 -199.7 8.4 8.4 14.958 15.441 12.219 12.503 11.872 11.671 2.938 85.0 b UPM 1542-5659 848144097 118835541 -171.0 -207.7 2.8 2.9 14.702 14.200 12.327 12.050 11.401 11.247 2.150 96.0 UPM 1542-5041 848609832 141523338 182.4 -16.3 3.6 3.6 · · · 9.924 9.592 9.440 8.867 8.690 0.484 33.1 b ,f UPM 1543-5449 848811762 126606709 -149.9 -135.8 10.4 8.2 16.944 15.432 13.822 12.092 11.625 11.359 3.340 70.5 UPM 1543-5812 848814656 114427930 -204.9 -101.7 6.9 6.6 15.176 13.101 11.994 10.727 10.080 9.847 2.374 45.0 UPM 1543-7306 848944114 60833296 -136.4 -124.6 6.3 5.6 14.182 13.352 12.361 11.797 11.119 11.016 1.555 98.1 UPM 1544-5208 849748641 136318898 -57.1 -180.3 7.6 7.5 17.691 16.196 14.821 12.951 12.442 12.262 3.245 111.1 UPM 1544-5341 850150522 130717165 -259.8 -95.8 6.8 7.1 17.198 15.609 14.004 12.663 12.117 11.920 2.946 106.0 UPM 1545-5259 850605613 133228438 -182.9 -168.4 5.4 3.6 17.864 16.312 14.084 12.045 11.455 11.147 4.267 40.8 UPM 1545-5018 851366897 142904161 -252.2 -81.7 9.0 8.3 13.765 12.692 11.167 10.694 10.093 9.841 1.998 53.9 f UPM 1548-5045A 853752961 141274236 -92.4 -175.3 6.9 6.5 15.788 13.638 11.611 10.526 9.912 9.660 3.112 30.6 c UPM 1548-5045B 853766317 141285738 -57.1 -155.8 8.5 8.5 18.117 16.525 14.265 12.184 11.580 11.295 4.341 41.9 c ,d ,e UPM 1549-8434 854968181 19516753 -82.3 -227.6 3.6 3.1 14.195 13.148 12.361 13.187 12.606 12.344 -0.039 227.6 b ,h UPM 1555-5939 859698048 109256622 -148.1 -139.3 7.1 9.2 16.489 15.353 14.277 13.814 13.177 12.962 1.539 [242.2] a UPM 1556-4823 861083858 149761425 -177.9 -187.5 7.2 20.4 14.810 14.203 12.467 11.234 10.637 10.404 2.969 56.9 UPM 1557-4852 861748184 148032598 -155.8 -90.3 12.7 8.6 16.301 14.588 12.855 11.408 10.922 10.709 3.180 54.2 UPM 1557-8159 862016282 28823775 -195.9 -195.8 9.4 9.9 16.861 14.747 12.909 11.655 11.101 10.850 3.092 54.0 UPM 1600-8109 864215257 31836852 -211.6 -5.7 11.3 11.4 17.252 15.740 13.875 12.369 11.846 11.606 3.371 77.8 UPM 1600-7402 864883254 57469688 -150.2 -108.1 5.6 8.1 18.249 16.461 15.124 12.875 12.309 12.080 3.586 81.2 UPM 1602-5650 866299723 119342424 -140.2 -115.0 4.5 4.5 15.480 · · · 12.298 10.461 9.865 9.617 · · · 29.3 UPM 1603-4710 867405600 154185744 -127.6 -132.7 8.3 16.6 17.317 15.898 14.368 11.992 11.456 11.183 3.906 51.4 UPM 1606-5801 869542767 115123561 -163.3 -152.5 27.1 27.1 15.164 13.617 11.964 11.369 10.723 10.479 2.248 70.9 UPM 1606-5502 870063998 125864104 170.0 -97.6 16.5 16.5 17.273 14.092 13.190 12.050 11.416 11.188 2.042 78.5 h UPM 1606-6424 870071528 92152496 -87.6 -180.2 4.7 13.2 16.111 14.240 12.086 11.667 11.033 10.848 2.573 72.5 UPM 1612-6211 875631410 100096982 -224.6 -196.4 9.4 10.0 15.267 13.734 11.920 11.881 11.321 10.990 1.853 90.8 UPM 1614-5644 877400692 119748242 -172.4 132.6 36.6 6.6 18.660 15.727 16.251 12.346 11.702 11.535 3.381 39.8 UPM 1616-5634 879009940 120353677 -70.2 178.7 9.7 9.7 · · · · · · · · · 11.411 10.838 10.628 · · · · · · UPM 1617-6126 879365812 102805939 179.1 42.7 17.7 4.8 13.051 12.228 11.139 11.461 10.892 10.685 0.767 88.4 b UPM 1618-5500 880614502 125984834 -157.1 -140.8 11.6 8.8 16.144 14.059 12.493 11.928 11.333 11.116 2.131 92.5 UPM 1622-5139 884266236 138014836 -175.0 -71.2 4.6 4.7 · · · · · · · · · 12.950 12.303 12.138 · · · · · · UPM 1626-5519 887625825 124812716 59.6 184.7 13.0 12.5 · · · · · · · · · 12.012 11.358 11.126 · · · · · · UPM 1628-4844 890083966 148558590 -75.0 -172.4 7.0 7.5 16.048 13.841 11.418 10.613 10.014 9.704 3.228 30.4 UPM 1629-6116 890347726 103423813 -82.8 -214.7 13.2 13.7 15.763 15.487 12.728 12.748 12.150 11.907 2.739 101.2 b UPM 1632-5634 893446159 120340545 -107.2 -165.7 9.5 27.5 17.638 16.345 14.770 12.654 12.149 11.885 3.691 80.2 UPM 1635-5202 896058321 136679193 -185.5 94.4 12.3 9.3 16.727 14.731 12.217 10.408 9.795 9.559 4.323 17.6 UPM 1636-8117 896834696 31361390 164.7 -165.3 11.3 10.8 16.856 14.775 12.984 11.730 11.194 10.924 3.045 57.6 UPM 1637-5341 897823748 130696230 -145.2 -177.6 14.8 14.8 17.660 14.602 15.098 13.321 12.569 12.422 1.281 [155.0] a ,f UPM 1640-5303 900133048 132983329 -29.3 -180.0 10.9 6.1 16.624 14.572 12.596 12.182 11.541 11.324 2.390 92.7 UPM 1641-4957 901066844 144129914 -176.7 -65.6 8.8 8.8 · · · 15.196 13.389 11.012 10.478 10.202 4.184 22.0 UPM 1641-4822 901220912 149877925 -184.8 -111.7 6.9 6.9 16.645 15.221 13.345 11.625 11.119 10.836 3.596 50.1 UPM 1641-5351 901600603 130095538 -123.7 -159.0 8.5 8.5 14.447 12.496 10.954 11.853 11.255 11.023 0.643 84.5 b

Table 2—Continued

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 1643-6144 903514948 101747311 -130.5 -125.0 8.3 8.4 17.004 14.684 13.184 12.734 12.159 11.972 1.950 141.3 UPM 1644-4757 904185355 151357617 130.5 -146.0 9.9 9.6 17.355 15.071 13.129 11.733 11.181 10.903 3.338 47.5 UPM 1645-4853 905208118 148011805 -79.3 -185.3 12.0 12.3 18.232 16.791 15.248 13.113 12.607 12.331 3.678 95.5 UPM 1651-5406 910203559 129209633 -25.3 -190.5 8.7 5.2 14.705 12.587 10.957 9.955 9.302 9.103 2.632 29.0 UPM 1658-5934 916311580 109519753 129.4 164.2 11.3 11.2 16.306 14.415 12.710 11.745 11.086 10.882 2.670 68.1 UPM 1658-5311A 917041848 132497063 -163.5 -229.3 8.2 7.8 15.892 13.661 11.399 10.490 9.914 9.560 3.171 28.6 c UPM 1658-5311B 917159205 132450388 -11.6 -134.1 9.5 9.4 16.346 14.562 11.906 11.001 10.400 10.014 3.561 33.0 c ,d ,e ,h UPM 1703-5441 921435004 127082284 -171.6 -150.6 5.3 5.4 16.594 15.442 13.273 12.643 12.124 11.935 2.799 128.5 UPM 1703-4934B 921462541 145546027 -28.6 72.6 31.3 31.3 15.243 17.305 16.288 11.005 10.397 10.132 6.300 40.7 c ,d ,e ,f UPM 1704-7751 922050168 43712233 -162.3 -196.3 11.2 10.9 18.261 16.287 14.432 13.197 12.657 12.449 3.090 118.0 UPM 1704-8055 922365146 32647192 -109.9 -229.3 15.6 12.3 18.327 16.572 15.085 13.459 12.921 12.666 3.113 131.7 UPM 1706-5449 924280382 126610913 -84.1 -215.3 48.8 42.1 15.393 14.004 12.177 11.549 10.972 10.756 2.455 78.7 UPM 1709-5644 926355078 119715597 -82.3 -160.7 3.6 3.8 15.744 14.072 12.643 11.914 11.329 11.127 2.158 97.7 UPM 1710-5300 927664633 133174754 -34.3 -179.9 2.5 1.5 12.469 10.032 7.989 8.001 7.407 7.163 2.031 13.5 UPM 1713-7336 930246842 59036684 -66.7 -182.7 7.9 18.1 17.420 15.351 13.715 12.637 12.030 11.795 2.714 98.4 UPM 1719-6255B 935394345 97476797 -94.0 -153.7 6.8 7.2 17.187 15.079 13.376 12.554 12.016 11.735 2.525 105.6 c UPM 1720-4836 936087252 149033584 -78.1 -167.1 7.8 28.8 16.962 15.144 13.163 12.115 11.508 11.290 3.029 72.9 UPM 1725-4709 941154374 154211346 -57.6 -191.5 6.9 6.6 15.987 13.942 12.770 12.865 12.232 12.013 1.077 [168.1] a ,b UPM 1727-6239 942304521 98410597 -230.9 -48.7 9.7 9.3 16.500 13.266 11.233 11.034 10.434 10.182 2.232 47.7 UPM 1728-5128 943526046 138700980 -29.6 -178.3 7.3 6.7 17.366 14.772 13.268 12.348 11.809 11.558 2.424 91.9 UPM 1732-4700 947055769 154749702 -45.8 -174.9 3.0 3.0 16.079 14.033 11.310 11.327 10.752 10.551 2.706 50.7 UPM 1732-4736 947129106 152581933 -205.7 -203.9 6.9 6.7 14.880 12.769 10.996 9.586 8.977 8.682 3.183 18.5 UPM 1744-4922 958370713 146277461 -139.9 -127.0 46.4 6.9 17.069 15.168 14.370 13.521 12.964 12.794 1.647 [227.4] a UPM 1746-5251 959779165 133698582 -160.1 191.7 5.4 5.7 17.552 15.253 13.867 13.050 12.447 12.282 2.203 147.8 f UPM 1748-7247 961476350 61937161 -195.5 -246.2 11.9 10.2 17.436 15.452 13.687 12.481 11.941 11.722 2.971 88.5 UPM 1749-7530 962401296 52159553 159.0 -113.5 9.0 9.0 14.809 13.643 12.653 12.925 12.363 12.117 0.718 181.6 UPM 1754-7701 967289539 46733484 -1.3 -208.7 10.4 10.6 14.829 13.029 12.189 11.369 10.680 10.578 1.660 78.9 UPM 1756-7406A 969047217 57217628 -78.4 -201.7 15.6 15.6 18.282 16.576 14.247 12.051 11.470 11.236 4.525 37.3 c UPM 1756-7406B 969067800 57217099 -279.1 -203.5 9.3 10.8 · · · 17.937 · · · 13.836 13.318 12.960 4.101 83.4 b ,c ,d UPM 1756-6126 969289853 102830753 -50.2 -173.6 6.9 17.6 16.331 13.869 12.214 11.073 10.526 10.282 2.796 44.3 UPM 1758-4705 970965439 154485573 156.1 -93.2 7.8 7.9 16.856 14.924 13.319 12.708 12.175 11.932 2.216 135.6 UPM 1812-6433 983319061 91560079 -13.6 -181.7 10.5 9.9 16.634 13.901 12.936 11.822 11.244 11.008 2.079 78.3 UPM 1815-6406 985813582 93223937 -178.9 -178.5 5.2 4.5 14.412 12.436 10.579 9.748 9.219 8.965 2.688 28.6 UPM 1817-8649 987374698 11424241 -189.2 237.9 10.3 11.0 16.396 14.483 · · · 11.927 11.369 11.161 2.556 85.2 UPM 1824-4850 994028323 148141997 163.0 -243.1 9.0 9.7 16.821 14.645 13.265 12.647 12.069 11.859 1.998 134.5 f UPM 1833-7136 1002337631 66220145 -6.7 -188.9 14.9 13.8 18.476 16.563 14.288 12.973 12.340 12.102 3.590 79.7 UPM 1834-6047 1003145785 105173051 14.7 -189.0 10.2 9.8 14.884 13.363 11.637 10.850 10.274 10.038 2.513 54.0 f UPM 1836-5826 1004981205 113593259 61.4 -177.6 5.2 6.1 16.118 14.741 13.216 12.081 11.409 11.135 2.660 82.7 UPM 1852-6027 1018955088 106373799 -218.6 -204.3 7.7 7.8 16.450 14.503 12.940 11.684 11.116 10.900 2.819 64.3 UPM 1858-6804 1024609765 78939442 -129.6 -125.5 5.5 3.8 16.990 15.315 14.638 13.659 13.213 13.034 1.656 [243.8] a UPM 1900-7029 1026744100 70203767 -54.0 -173.7 8.3 8.4 17.506 15.443 13.346 11.990 11.408 11.145 3.453 52.9 UPM 1909-4927 1034415320 145978861 -127.5 -222.8 13.5 10.6 17.147 15.145 13.945 13.029 12.383 12.195 2.116 151.4 UPM 1912-4942 1037156800 145077070 24.7 -189.1 9.0 9.2 16.544 14.410 12.745 11.732 11.107 10.890 2.678 65.0 UPM 1917-6941 1041816777 73138163 35.6 -208.4 11.7 10.0 16.928 15.030 12.970 11.763 11.149 10.882 3.267 52.6 f UPM 1923-5050 1047094221 140965899 -152.7 -96.9 14.5 10.5 15.979 14.159 13.200 12.438 11.863 11.722 1.721 137.5 UPM 1924-5328 1048004792 131493209 -120.3 137.8 2.8 2.7 13.888 11.697 10.744 10.919 10.301 10.073 0.778 70.0 b UPM 1924-6646 1048323630 83623834 49.2 -202.2 8.1 8.3 16.538 14.551 12.610 11.645 11.073 10.878 2.906 62.3 UPM 1926-5838 1050092012 112868363 -262.3 -182.4 8.7 8.9 16.783 14.705 12.843 11.047 10.570 10.298 3.658 32.8 UPM 1927-6334 1050328043 95124273 201.0 -144.0 35.7 15.1 17.580 15.245 14.151 12.991 12.462 12.259 2.254 142.4 UPM 1930-7112 1053133323 67662282 -153.4 -109.2 9.1 9.3 16.626 14.906 12.993 11.722 11.111 10.833 3.184 55.0 UPM 1932-6707 1055210338 82373484 39.4 -188.9 2.5 3.4 14.962 13.038 12.098 11.033 10.422 10.257 2.005 65.3 UPM 1935-5936 1057892042 109409490 45.0 -194.9 9.4 9.6 16.515 14.637 12.770 11.755 11.128 10.893 2.882 63.1 UPM 1941-4928 1063289596 145911664 -180.0 -30.6 9.0 9.0 16.876 12.514 11.181 11.367 10.808 10.514 1.147 58.9 UPM 1943-6049 1065224052 105007320 -61.9 -216.5 9.7 9.8 17.207 15.251 13.636 12.565 11.991 11.785 2.686 103.0 UPM 1950-6013B 1071297914 107145608 · · · · · · · · · · · · · · · · · · · · · 13.978 13.500 13.202 · · · · · · c ,d UPM 1950-6013A 1071312857 107171254 -31.2 -268.7 10.1 10.3 15.298 13.502 12.186 11.538 11.009 10.771 1.964 87.1 c UPM 1952-5539 1073529066 123644245 18.1 -188.5 11.8 12.1 14.853 13.632 12.898 12.297 11.862 11.801 1.335 148.1 UPM 1956-6116 1076858244 103394149 -151.0 -167.7 9.7 10.4 18.048 16.396 15.079 13.653 13.080 12.919 2.743 178.1 UPM 2002-4735 1082313871 152672097 16.5 -199.3 10.8 11.1 16.823 15.193 14.310 13.745 13.137 12.931 1.448 [248.6] a UPM 2008-6305B 1088024100 96844499 77.4 -181.2 13.3 14.7 13.811 12.005 10.679 12.395 11.150 11.582 -0.390 125.7 b ,c ,d UPM 2010-5353 1089659723 129992428 -3.9 -218.7 8.7 9.1 17.183 14.982 12.701 11.399 10.732 10.446 3.583 34.5 UPM 2013-5751 1092393887 115706680 37.1 -257.5 11.5 12.4 15.821 14.400 13.682 12.930 12.373 12.298 1.470 [181.8] a ,f UPM 2021-5858 1099009333 111686918 -150.9 -181.6 17.4 16.7 18.041 16.064 14.328 13.016 12.519 12.238 3.048 108.5 UPM 2024-4824 1102094399 149701952 -180.5 -46.0 3.9 3.9 17.838 15.911 14.287 13.138 12.638 12.406 2.773 135.0

Table 2—Continued

Name RA DEC μα cos δ μδ sigμα sigμδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 2036-5548A 1112699891 123087548 45.1 -174.6 2.3 2.1 16.152 13.565 12.298 12.103 11.511 11.324 1.462 114.8 c ,f UPM 2036-5548B 1112708550 123089700 · · · · · · · · · · · · 19.025 · · · · · · 14.229 13.732 13.493 · · · 233.8 b ,c ,d UPM 2038-4938 1114739048 145270905 70.2 -204.3 9.4 10.0 15.787 13.595 11.507 10.754 10.089 9.838 2.841 37.2 UPM 2042-5552 1117911466 122822515 -237.8 -87.2 13.6 10.9 17.157 15.252 14.108 12.839 12.320 12.073 2.413 132.0 UPM 2043-5751 1119153753 115707535 249.5 -125.3 13.5 12.6 18.103 16.133 14.452 12.891 12.309 12.068 3.242 89.2 UPM 2049-5415B 1124176381 128699125 197.2 44.3 7.0 11.8 18.253 16.119 14.134 12.625 12.006 11.717 3.494 64.7 c ,d UPM 2049-5415A 1124200971 128684871 180.4 53.2 11.4 11.1 16.068 13.982 12.284 11.104 10.480 10.244 2.878 44.3 c UPM 2050-5044 1125736631 141342485 209.4 -17.7 8.9 8.9 17.608 15.385 13.619 12.420 11.864 11.620 2.965 79.7 UPM 2051-5733 1126543636 116760305 124.5 -130.1 8.0 6.8 17.840 15.995 14.387 12.742 12.147 11.891 3.253 83.5 UPM 2055-6059 1130089106 104450175 91.2 -164.8 11.3 11.3 16.081 14.762 13.173 11.509 10.955 10.684 3.253 54.6 UPM 2057-5839 1132155449 112852294 185.8 -261.0 10.0 10.3 16.739 14.688 13.046 11.610 10.990 10.770 3.078 51.6 UPM 2059-5711 1133803361 118094897 194.7 -136.3 18.2 18.2 18.607 16.418 14.608 13.039 12.442 12.169 3.379 83.1 UPM 2106-5706B 1139440736 118437233 162.6 -178.8 16.3 15.1 18.226 16.111 14.254 12.687 12.186 11.927 3.424 76.6 c UPM 2109-5305 1142615989 132880256 33.0 -207.9 14.4 14.5 18.133 15.963 15.182 14.271 13.625 13.314 1.692 [279.0] a UPM 2112-5121 1145134513 139091864 153.6 -137.4 7.5 8.5 16.504 14.213 11.974 11.122 10.491 10.221 3.091 39.5 UPM 2112-5954 1145241065 108340688 -177.4 -51.5 11.5 11.5 15.928 14.047 12.755 11.392 10.773 10.583 2.655 59.2 UPM 2112-6215 1145389750 99864555 -76.1 175.3 5.0 4.2 · · · · · · · · · 13.961 13.358 13.204 · · · · · · UPM 2113-5307 1146511831 132730907 211.6 -172.0 12.5 11.4 17.439 15.535 14.916 13.617 12.999 12.869 1.918 [211.7] a UPM 2114-5545 1147399145 123271869 -147.6 -113.1 2.3 2.3 13.292 11.856 11.127 10.571 10.047 9.949 1.285 63.1 UPM 2119-5856 1151370742 111836222 -142.4 -117.5 10.4 3.5 15.891 14.298 12.323 11.383 10.758 10.492 2.915 55.2 UPM 2119-8445 1151637008 18871742 -47.9 -174.6 4.2 4.2 · · · · · · · · · 11.413 10.817 10.575 · · · · · · UPM 2129-7843 1160418602 40599605 14.9 -179.8 11.7 3.9 15.628 14.579 14.055 12.986 12.402 12.264 1.593 153.4 UPM 2148-5404 1177649631 129334900 -135.2 -119.2 4.3 2.5 17.123 15.118 13.384 11.960 11.344 11.101 3.158 58.6 UPM 2247-5707 1230566367 118338374 179.7 -120.1 12.6 12.7 17.245 15.259 13.878 12.656 12.167 11.879 2.603 111.0 UPM 2316-6309 1256781310 96640937 248.8 41.7 10.4 10.3 17.413 15.371 13.843 12.257 11.699 11.494 3.114 72.1 UPM 2353-7426 1289770038 55991827 24.1 -179.1 4.2 3.8 16.614 14.526 13.240 12.605 12.032 11.884 1.921 142.2

a Subdwarf candidate picked from RPM diagram; plate distance [in bracket] is incorrect

b Number of relations used for distance estimate < 6: plate distance less reliable

c Common proper motion companion; see Table 4

d Not detected during automated search but noticed by eye during the blinking process

e Proper motions suspect

f Possible NLTT star with a position difference > 90′′ when compared to UCAC3 position

g Source not in 2MASS

h SuperCOSMOS plate magnitudes suspect

Table 3 New UCAC3 High Proper Motion Systems estimated to be within 25 pc between Declinations −90^∘ and −47^∘ with 0.^{′′}40 yr^{−1} > μ ≥ 0.^{′′}18 yr^{−1}

Name RA DEC μα cos δ μδ sig μα sig μδ BJ R59F IIV N J H Ks R59F − J Est Dist Notes (mas) (mas) (mas/yr) (mas/yr) (mas/yr) (mas/yr) (pc)

UPM 0559-5225 323598169 135295015 120.7 152.6 4.5 4.4 14.532 12.000 10.287 9.628 8.951 8.703 2.372 24.9 UPM 0621-6111 343586117 103726637 11.4 204.6 5.8 5.3 16.108 14.256 12.028 10.427 9.788 9.534 3.829 21.8 UPM 0901-6526 487375530 88399668 -68.4 196.4 6.7 6.7 16.269 14.219 11.471 10.140 9.589 9.282 4.079 18.0 UPM 1104-6232 598106935 98845495 -207.8 -58.5 6.0 6.2 16.423 14.086 11.484 10.256 9.677 9.357 3.830 19.4 UPM 1105-5825A 598956034 113681441 -176.1 51.5 4.2 4.2 16.916 · · · 13.713 10.298 9.711 9.496 · · · 15.2 a ,b UPM 1142-6440 632248846 91165839 -183.4 -205.1 32.2 16.8 16.067 14.081 11.418 10.393 9.846 9.481 3.688 23.7 UPM 1230-5736B 675249073 116560461 -243.0 -29.3 6.9 6.5 14.928 12.828 10.998 9.694 9.033 8.785 3.134 19.8 a ,c UPM 1230-5736A 675783245 116623954 -227.6 -66.5 6.8 6.5 13.794 12.035 10.550 9.348 8.712 8.445 2.687 22.2 a ,c UPM 1354-7121 751408498 67092222 -165.0 -132.7 6.5 6.8 12.598 10.665 8.750 8.549 7.920 7.672 2.116 19.3 UPM 1401-6405A 757555362 93281664 -172.2 -140.9 7.1 7.0 15.536 13.909 12.787 10.296 9.649 9.407 3.613 24.1 a UPM 1454-5809 805350729 114653491 -36.4 188.0 13.1 13.1 16.770 14.890 13.200 10.635 10.063 9.776 4.255 20.9 UPM 1523-5454 831355688 126325591 -60.6 200.9 14.9 14.9 17.770 11.791 9.697 9.767 9.194 8.871 2.024 20.4 UPM 1635-5202 896058321 136679193 -185.5 94.4 12.3 9.3 16.727 14.731 12.217 10.408 9.795 9.559 4.323 17.6 UPM 1641-4957 901066844 144129914 -176.7 -65.6 8.8 8.8 · · · 15.196 13.389 11.012 10.478 10.202 4.184 22.0 UPM 1710-5300 927664633 133174754 -34.3 -179.9 2.5 1.5 12.469 10.032 7.989 8.001 7.407 7.163 2.031 13.5 UPM 1732-4736 947129106 152581933 -205.7 -203.9 6.9 6.7 14.880 12.769 10.996 9.586 8.977 8.682 3.183 18.5

aCommon proper motion companion; see Table 4

bSuperCOSMOS plate magnitudes suspect

cPossible NLTT star with a position difference > 90′′ when compared to UCAC3 position

Table 4 Common Proper Motion Candidate Systems

Primary μ_α cos δ μ_δ Distance Secondary/Tertiary μ_α cos δ μ_δ Distance Separation θ notes (mas/yr) (mas/yr) (pc) (mas/yr) (mas/yr) (pc) (^{′′}) (^∘)

UPM 0111-7655A 130.0 31.4 64.4 UPM 0111-7655B 182.5 35.6 109.9 46.8 241.7^a ,^f UPM 0245-8833A 174.6 59.1 34.5 UPM 0245-8833B 175.7 89.7 · · · 6.8 15.0^a UPM 0320-4847A 230.8 147.8 37.7 UPM 0320-4847B 208.7 93.3 396.9 41.7 280.2^a ,^b UPM 0533-5210A -80.5 180.7 58.2 UPM 0533-5210B · · · · · · · · · 7.7 161.4^a UPM 0608-5301A -131.1 208.6 37.1 WD 0607-530B -115.5 172.1 [98.8] 21.5 120.7^a ,^c ,^d , 34.2pc UPM 0740-5207A -37.7 -221.5 38.9 UPM 0740-5207B 6.6 -240.0 · · · 15.4 34.2^a ,^e NLTT 19906A -150.5 338.0 · · · NLTT 19907B -150.5 338.0 · · · 5.1 71.5^f UPM 0835-6018C -184.6 -17.7 50.3 113.0 49.3^f UPM 0837-6435A -46.7 175.2 46.0 UPM 0837-6435B -29.6 158.4 106.6 9.4 281.6^a ,^f UPM 0846-7345A -129.3 127.6 61.6 UPM 0846-7345B -125.4 112.9 88.4 24.2 184.6^a ,^f UPM 0928-5442A -129.4 137.3 57.1 UPM 0928-5442B -91.0 147.9 93.0 26.6 87.9^a ,^g ,^f UPM 1040-5728A -151.4 131.1 88.8 UPM 1040-5728B -224.2 138.9 164.7 7.3 102.1^a ,^d ,^g UPM 1044-7053A -217.5 17.6 57.8 UPM 1044-7053B -217.5 36.5 92.3 34.8 178.9^a UPM 1104-7107A -197.3 -83.8 60.9 UPM 1104-7107B 20.3 23.1 44.6 10.8 28.6^a ,^d ,^f ,^g UPM 1105-5825A -176.1 51.5 15.2 UPM 1105-5825B -141.8 56.9 38.4 32.3 59.5^a ,^f ,^g UPM 1136-5358A -215.3 -74.1 36.3 UPM 1136-5358B -247.7 -69.6 · · · 15.9 1.1^a ,^b ,^e ,^g NLTT 29430A -175.4 -42.5 · · · UPM 1203-4910B -177.1 -40.5 97.5 41.4 270.2^a UPM 1230-5736A -227.6 -66.5 22.2 UPM 1230-5736B -243.0 -29.3 19.8 293.1 257.5^b UPM 1401-6405A -172.2 -140.9 24.1 UPM 1401-6405B -185.2 -149.3 76.3 30.1 339.1^a UPM 1414-6023A -200.8 -87.5 78.4 UPM 1414-6023B -189.1 -61.3 · · · 11.3 21.5^a ,^e NLTT 37372A -180.8 -79.8 80.4 UPM 1430-7722B -67.0 -44.4 280.6 18.8 37.5^a ,^f UPM 1503-5007A -238.2 -193.2 57.6 UPM 1503-5007B · · · · · · · · · 7.5 358.6^a UPM 1528-5839A 2.1 -197.2 33.3 UPM 1528-5839B 5.9 -197.8 · · · 13.0 250.3^a ,^e UPM 1548-5045A -92.4 -175.3 30.6 UPM 1548-5045B -57.1 -155.8 41.9 14.3 36.3^a ,^f UPM 1658-5311A -163.5 -229.3 28.6 UPM 1658-5311B -11.6 -134.1 33.0 84.4 123.6^a ,^g ,^f NLTT 44051A -189.2 19.2 38.5 UPM 1703-4934B -28.6 72.6 40.7 8.1 315.1^a ,^b ,^g ,^f WT 549A -94.4 -155.3 65.5 UPM 1719-6255B -94.0 -153.7 105.6 84.0 185.0^a UPM 1756-7406A -78.4 -201.7 37.3 UPM 1756-7406B -279.1 -203.5 83.4 5.7 95.4^a ,^d UPM 1950-6013A -31.2 -268.7 87.1 UPM 1950-6013B · · · · · · · · · 26.7 196.1^a NLTT 48738A 52.5 -173.0 43.4 UPM 2008-6305B 77.4 -181.2 125.7 5.7 67.2^a ,^d UPM 2036-5548A 45.1 -174.6 114.8 UPM 2036-5548B · · · · · · 233.8 5.3 66.1^a ,^b ,^d UPM 2049-5415A 180.4 53.2 44.3 UPM 2049-5415B 197.2 44.3 64.7 20.2 314.8^a NLTT 50475A 133.9 -198.0 12.5 UPM 2106-5706B 162.6 -178.8 76.6 166.4 356.4^a ,^d

a Not detected during automated search but noticed by eye during the blinking process

b Possible NLTT star with a position difference > 90^{′′} when compared to UCAC3 position

c White dwarf, plate distance [in bracket] is incorrect with a more accurate distance in the notes

d Number of relations used for distance estimate < 6; plate distance less reliable

e Source not in 2MASS f Proper motions suspect g SuperCOSMOS plate magnitudes suspect