arXiv:1002.0691v1 [astro-ph.CO] 3 Feb 2010

Mon. Not. R. Astron. Soc. 000, 1–?? (2009) Printed 6 May 2019 (MN L^ATEX style file v2.2)

Deep GMRT 150 MHz observations of the LBDS-Lynx region: Ultra-Steep Spectrum Radio Sources

C. H. Ishwara-Chandra^{1,2⋆}, S. K. Sirothia^1†, Y. Wadadekar^1‡, S. Pal^3§, R. Windhorst^4¶

1National Centre for Radio Astrophysics, TIFR, Post Bag No. 3., Ganeshkhind, Pune 411007, India 2Inter-University Centre for Astronomy and Astrophysics, Post Bag 4, Ganeshkhind, Pune 411007, India 3International Centre for Radio Astronomical Research, University of Western Australia, 35 Stirling Highway, WA, 6009, Australia 4School of Earth & Space Exploration, Arizona State University P.O. Box 871404 Tempe, AZ 85287-1404, USA

ABSTRACT

It has been known for nearly three decades that high redshift radio galaxies exhibit steep radio spectra, and hence ultra-steep spectrum radio sources provide candidates for high-redshift radio galaxies. Nearly all radio galaxies with z > 3 have been found using this redshift-spectral index correlation. We have started a programme with the Giant Metrewave Radio Telescope (GMRT) to exploit this correlation at flux density levels about 10 to 100 times deeper than the known high-redshift radio galaxies which were identified primarily using the already available radio catalogues. In our programme, we have obtained deep, high resolution radio observations at 150 MHz with GMRT for several^′deep^′ fields which are well studied at higher radio frequencies and in other bands of the electromagnetic spectrum, with an aim to detect candidate high redshift radio galaxies. In this paper we present results from the deep 150 MHz observations of LBDS-Lynx field, which has been already imaged at 327, 610 and 1412 MHz with the Westerbork Synthesis Radio Telescope (WSRT) and at 1400 and 4860 MHz with the Very Large Array (VLA). The 150 MHz image made with GMRT has a rms noise of ∼ 0.7 mJy/beam and a resolution of ∼ 19^{′′} × 15^{′′} . It is the deepest low frequency image of the LBDS-Lynx field. The source catalog of this field at 150 MHz has about 765 sources down to ∼ 20% of the primary beam response, covering an area of about 15 degree^2. Spectral index was estimated by cross correlating each source detected at 150 MHz with the available observations at 327, 610, 1400 and 4860 MHz and also using available radio surveys such as WENSS at 327 MHz and NVSS and FIRST at 1400 MHz. We find about 150 radio sources with spectra steeper than 1. About two-third of these are not detected in Sloan Digital Sky Survey, hence are strong candidate high-redshift radio galaxies, which need to be further explored with deep infra-red imaging and spectroscopy to estimate the redshift.

Key words: galaxies: active - galaxies: high-redshift - radio continuum: galaxies

1 INTRODUCTION

Since powerful radio sources reside in massive ellipticals (Best et al. 1998), finding radio galaxies at high redshifts is important to understand the radio evolution of galaxies. It had been noticed in the early 80’s that the fraction of radio sources that can be optically identified is lower by a factor of 3 or more for steep spectrum radio sources

⋆ E-mail: ishwar@ncra.tifr.res.in † E-mail:sirothia@ncra.tifr.res.in ‡ E-mail:yogesh@ncra.tifr.res.in § E-mail:spal@cyllene.uwa.edu.au ¶ E-mail:Rogier.Windhorst@asu.edu

(α > 1; Sν ∝ ν^{−α}; Tielens, Miley & Wills, 1979, Blumenthal & Miley, 1979; Gopal-Krishna & Steppe, 1981), suggesting that the radio sources with steeper spectra at decimeter wavelengths are more distant compared to the ones with normal spectra (1 > α > 0.5). Over the years, this correlation has been exploited to search for radio sources at high redshifts (Rottgering et al., 1994; De Breuck et al. 2000, 2002; Klamer et al. 2006). Since the radio emission does not suffer from dust absorption, selecting candidate high redshift radio galaxies (HzRGs) at radio frequencies provides an optically unbiased sample. The most distant radio galaxy at z = 5.19 was discovered using the spectral index - redshift correlation (van Breugel et al. 1999). Until today, about 45 radio galaxies are known beyond redshift of 3, and nearly all

© 2009 RAS

2 C. H. Ishwara-Chandra et al.

of them were discovered through the radio spectral index - redshift correlation. Thus, this is the most efficient method to find HzRGs.

In addition to constraining models of formation and evolution of massive galaxies, HzRGs can also be used to study the environment at those epochs. Deep radio polarimetric observations of several HzRGs have shown large rotation measures (RM) of the order of thousands of rad m^{−2} (Pentericci et al. 2000; Carilli et al. 1997; Athreya et al. 1998; Kronberg et al. 2008). Pentericci et al. (2000) also found that the fraction of radio galaxies with extreme Faraday rotation is increasing with redshift which is consistent with the hypothesis that the environment is denser at high redshift. Since at moderate redshifts large RMs are known to occur in radio galaxies residing near the center of clusters of galaxies, the HzRGs are an excellent tool to study the (proto) cluster environment at high redshifts. It is therefore important to identify and study as many HzRGs as possible.

A major programme to search for HzRGs using the radio spectral index - redshift correlation was carried out in the last decade using different radio surveys at 1400 MHz and lower frequencies (eg: Rottgering et al. 1994, De Breuck et al. 2000, 2002, 2004, 2006; Klamer et al. 2006; see also review by Miley and De Breuck, 2008). The searches were mostly limited by the sensitivity limit of these shallow, widearea radio surveys. This bias has led to the detection of only the brightest HzRGs which are at the top end of the radio luminosity function (See section 2), which is about three orders of magnitude brighter than the luminosities at the lower end of FR-II population (Fanaroff & Riley, 1974). Since steep spectrum radio sources are preferentially selected at low radio frequencies, deeper observations at these frequencies are needed to discover HzRGs that are 10 to 100 times less luminous than most of the known HzRGs, and these could be the high-redshift counterparts of more typical FR-II radio galaxies. The 150 MHz band of GMRT (Giant Metrewave Radio Telescope, India, http://www.ncra.tifr.res.in) with its large field of view (half-power beam width of 3 degrees), high angular resolution (∼ 20^{′′} ) and better sensitivity (∼ 1 mJy from a full synthesis observation) is well suited for this kind of work. For example, a steep spectrum radio source (α > 1) at the completeness limit of WENSS at 327 MHz (Rengelink et al. 1997), will have a flux density > 65 mJy at 150 MHz. Our experience with GMRT at 150 MHz shows that it is possible to reliably detect sources more than 10 times fainter than this value. The large field of view of GMRT also enables us to detect close to thousand radio sources in a single pointing. Encouraged by this, we have started a programme to observe several carefully chosen deep fields at 150 MHz with GMRT with an aim to detect steep spectrum radio sources to flux density levels much fainter than that of known highredshift radio sources (see Section 2). As the sample at low radio frequencies goes deeper, the available surveys at higher radio frequencies such as FIRST won’t be deep enough to get the spectral index estimates, particularly for steep spectrum sources. For example, from the present work, it is seen that if we use only the FIRST catalogue, 37% of the sources below 18 mJy at 150 MHz (which corresponds to 1 mJy at 1.4 GHz for a spectral index of 1.3) do not have counter parts in FIRST as against 9% for stronger sources. This limitation can be addressed by deeper surveys of this region at higher radio frequencies. Therefore, we have chosen the well known deep fields because significant amount of data already exist for them at higher radio frequencies and in the optical and infrared bands. These deep observations will allow us to estimate the spectral index for faint sources which are below the detection limit of NVSS or FIRST. The deep optical data will help to estimate the redshifts and eliminate nearby and known objects among the steep spectrum sources. Wherever needed, additional deep observations with the GMRT at 610 MHz will be obtained for a better estimate of radio spectra. In addition to the steep spectrum radio sources, this kind of survey will also help us to understand the evolution (LogN- LogS) and spectral index properties of faint radio sources, to detect low-power FRI sources, relic emission and large angular size radio sources.

In this paper we present deep 150 MHz radio observations of the LBDS-Lynx field with the GMRT with the primary aim of detecting steep spectrum radio sources which are candidate HzRGs. The Leiden-Berkeley Deep Survey (LBDS) in the Lynx area (Windhorst et al. 1984) was carried out in the mid eighties to better understand the nature of faint radio sources and their cosmological evolution. Multiband optical data were obtained with the Kitt Peak Mayall 4m telescope and subsequently deep radio observations were carried out at 327 MHz and 1412 MHz with WSRT, complimented by 1400 MHz and 4860 MHz imaging with the VLA (Windhorst et al 1984, 1985, Oort, 1987, Oort et al. 1988). These radio observations showed a moderate increase in the number of radio sources below ∼ 5 mJy at 1.4 GHz, which were predominantly identified with blue galaxies, a population responsible for the upturn in the source counts at faint flux density levels (Windhorst et al. 1985). The spectral index studies of radio sources selected at 327 MHz in this region using the 327 MHz and 1400 MHz data showed that the median spectral index was flatter for fainter sources selected at 327 MHz (Oort et al. 1988). The sources with the steepest spectra (α > 1) were mostly unidentified in the optical 4m telescope images, once again indicating that they were likely to be very distant.

The sources we detected at 150 MHz with the GMRT were compared with the deep observations of this region at 327, 610 and 1412 MHz with the WSRT and at 4860 MHz with the VLA. We have also used the available catalogues such as WENSS at 327 MHz and NVSS and FIRST at 1400 MHz to estimate spectral indices. We identify about 150 steep spectrum radio sources from this field. About twothird of them are not detected to the limit of SDSS, hence are strong candidate HzRGs. In Section 2, we present supporting arguments for reviving the search for HzRGs using the steep spectrum technique. Observations, data analysis and the data obtained are presented in Section 3. Results and discussions are presented in Section 4 and concluding remarks in Section 5.

2 RE-VISIT OF ULTRA-STEEP SPECTRUM TECHNIQUE FOR FINDING HZRGS

The method to find HzRGs using the correlation between steep radio spectrum and high redshift of the radio galaxy is the most efficient technique to discover HzRGs (e.g: Pedani, 2003; de Breuck et al. 2000). Till date about 45 radio galaxies have been discovered with z > 3 using this technique.

Deep GMRT 150 MHz observations of LBDS field 3

Figure 1. The 150 MHz flux densities of known HzRGs, extrapolated using the available spectral index and flux density measurements. The dotted line at the bottom indicates the observed 150 MHz flux density corresponding to the rest-frame FRI/FRII break luminosity. The dashed horizontal line is the GMRT detection limit from the present 150 MHz observation. It is clear from this figure that a large number ’normal population’ of FRIIs, that are 10 to 100 times less luminous than the known HzRGs are yet to be discovered.

Miley & de Breuck (2008) in their review have provided a table of all known HzRGs with redshift more than 2. We have independently surveyed the literature for an update on all HzRGs with redshift more than 3, which is provided in Table 1. A total of 47 galaxies are listed in the table, which is arranged as follows: Column 1: Source Name; Column 2: redshift; Column 3: radio spectral index (in a few cases where the spectral index was not known, we have assumed a value of 1); Column 4: observed flux density at 1.4 GHz; Column 5: estimated flux density at 150 MHz using the spectral index and the 1.4 GHz flux density, given in Columns 3 and 4; Column 6: Reference.

In order to understand whether the known HzRGs represent typical FRII radio sources at high-redshifts, or the highest luminosity sources in that category, we have computed the expected flux density at 150 MHz corresponding to the FRI/FRII break luminosity (assuming standard cosmological parameters of Ωm of 0.27, Ωvac of 0.73 and Ho of 71 kms^{−1}Mpc^{−1}; Bennett et al. 2003). We assume here that the FRI/FRII break luminosity does not evolve significantly with redshift. At a redshift of 3, the FRI/FRII break luminosity corresponds to a flux density of ∼ 4 mJy at 150 MHz (taking a spectral index of 1 for the K-correction). The corresponding values at redshift of 4 and 5 will be ∼ 1.9 and ∼ 1.1 mJy, respectively.

In Figure 1, we plot the observed flux densities at 150 MHz of all known HzRGs, computed using the available flux density measurements and the spectral index. The dotted line corresponds to the 150 MHz flux density at the FRI/FRII break luminosity computed for different redshifts, assuming Λ of 0.73 and ΩM of 0.27. It is clear from the figure that nearly all of the known HzRGs are two to three orders of magnitude more luminous than the FRI/FRII break luminosity. This is largely due to selection effects because nearly all the searches for steep spectrum radio sources use sky surveys such as WENSS and SUMSS (Mauch et al. 2003) at

Table 1. Known HzRGs till date, discovered mostly using ultra steep spectrum technique.

Source Name z α S_{1400} S_{150} Ref mJy mJy

B30032+412 3.658 1.16 102 1330 Jar01 NVSSJ012142+132058 3.516 1.37 55.4 1150 deB01 B20140+32 4.413 1.17 91.5 1220 Raw91 NVSSJ020510+224250 3.5061 1.37 58.4 1212 deB00 NVSSJ021308-322338 3.976 0.90 30.4 223 deB06 NVSSJ023111+360027 3.079 1.30 44.3 788 deB00 PMNJ0253-2708 3.16 1.03 273.3 2673 McC96 RCJ0311+0507 4.514 1.31 473.0 8597 Kop06 PKS0315-257 3.1307 1.05 424.0 4334 McC90 NVSSJ033953-232136 3.49 1.00^∗ 36.5 334 Cac00 NVSSJ034642+303949 3.72 1.42 34.9 809 deB02 4C+60.07 3.791 1.45 156.8 3885 Cha96 WNJ0617+5012 3.153 1.37 26.5 550 deB00 4C+41.17 3.792 1.51 235 6650 Cha96 WNJ0747+3654 2.992 1.41 36.8 835 deB00 NVSSJ075806+501104 2.996 1.07 98.0 1047 Cru06 NVSSJ083609+543325 3.341 1.02 62.7 600 Cru07 B20902+34 3.382 0.84 313 2010 Lil88 TNJ0924-2201 5.19 1.63 73.3 2705 van99 NVSSJ094724-210505 3.377 1.00^∗ 10.9 100 Bro06 NVSSJ095438-210425 3.431 1.00^∗ 51.3 469 Bro06 NVSSJ095751-213321 3.126 1.00^∗ 62.3 570 Bro06 NVSSJ104906-125819 3.697 1.51 108.1 3059 Bor07 6CB105034+544035 3.083 1.34 66.4 1290 deB00 NVSSJ105917-303658 3.263 1.06 64.7 676 Bry09 NVSSJ111223-294807 3.09 1.40 101.0 2240 deB00 B21121+31B 3.2174 1.46 74.0 1875 deB00 TNJ1123-2154 4.109 1.57 49.6 1603 deB00 4C+39.37 3.22 1.47 255.3 6612 Raw90 4C+03.24 3.5699 1.28 256 4354 Rot97 8C1435+635 4.261 1.31 451 8197 Lac94 TNJ1338-1942 4.11 1.31 122.9 2234 deB00 J163912+405236 4.88 0.75 21.8 114.7 Jar09 WN B1702+6042 3.223 1.24 53.2 828 Vil99 7C1814+670 4.05 1.09 236.1 2637 Lac99 4C+72.26 3.536 1.22 259 3857 deB01 TXS1911+636 3.59 1.42 23.3 540 deB01 MRC2005-134 3.837 1.42 115.4 2676 deB01 TNJ2009-3040 3.158 1.36 65.3 1326 Bor07 4C+18.61 3.056 0.87 575.3 3948 Ste99 4C+19.71 3.594 1.02 306 2927 Ste99 NVSSJ230123-364656 3.22 1.38 20.3 431 deB06 WNJ2313+4053 2.99 1.50 11.3 313 deB00 NVSSJ231402-372925 3.45 1.22 129.9 1934 deB06 NVSSJ231727-352606 3.874 1.19 59.2 825 deB06 NVSSJ232100-360223 3.32 1.65 15.1 583 deB06 B3J2330+3927 3.087 1.21 148.4 2162 Per05

∗The radio spectral index measurements were not available; so a spectral index of 1 was assumed.

References: Jar01: Jarvis et al. 2001; deB01: de Breuck et al. 2001; Raw91: Rawlings et al. 1991; deB00: de Breuck et al. 2000; deB06: de Breuck et al. 2006; McC96: McCarthy et al. 1996; Kop06: Kopylov et al. 2006; McC90: McCarthy et al. 1990; Cac00: Caccianiga et al, 2000; deB02: de Breuck et al. 2002; Cha96: Chambers et al. 1996; Cru06: Cruz et al. 2006; Cru07: Cruz et al. 2007; Lil88: Lilly, 1988; van99: van Breugel et al. 1999; Bro06: Brookes et al. 2006; Bor07: Bornancini et al. 2007; Bry09: Bryant et al. 2009; Raw90: Rawlings et al. 1990; Rot97: Rottgering et al. 1997; Lac94: Lacy et al. 1994; Jar09: Jarvis et al. 2009; Vil99: Vilani et al. 1999; Lac99: Lacy et al. 1999; Ste99: Stern et al. 1999; deB06: de Breuck et al. 2006; Per05: Perez-Torres et al. 2005.

4 C. H. Ishwara-Chandra et al.

low radio frequencies and NVSS at higher radio frequencies. This selection is biased towards stronger radio sources. The median flux density at 1400 MHz of the known HzRGs is ∼ 70 mJy and the corresponding flux density at 150 MHz is ∼ 1.3 Jy (90% of them are stronger than ∼ 0.5 Jy), whereas the FRI/FRII break luminosity is more than two orders of magnitude fainter.

The above argument implies that the known HzRGs represent the tip of the ice-berg in flux density. There are, potentially, a large number of HzRGs yet to be discovered which are expected to be 10 to 100 times less luminous than the known HzRGs (see Fig. 1). Although initially it was believed that there is a ’cut-off’ in the radio luminosity function at high-redshift, subsequent to the discovery of several radio galaxies at z > 4, this evidence became suspect (Jarvis et al 2001). The radio luminosity function (RLF) of HzRGs indicate that at luminosities 10 to 100 times lower than the known HzRGs, we could expect at least a 10 fold increase in space density of the radio sources beyond the redshift of 3 (Waddington et al. 2001).

Systematic efforts are needed to find this population of radio galaxies, which are not at the brightest end of the radio luminosity function. As mentioned earlier, the most efficient method to find high-redshift radio galaxies is through the steep spectrum selection. This large gap, can thus be filled by searching for steep spectrum sources using deep radio observations at low frequencies. The present observation of the LBDS field at 150 MHz with the GMRT has an rms noise of ∼ 0.7 mJy/beam, and the source catalog has about 750 sources having a flux density of ≳ 4 mJy. The sky coverage is about 7 degree^2 for half-power beamwidth and 15 degree^2 to the 20% of the peak primary beam response in a given pointing. A source at the threshold of detection in the FIRST survey will have a flux density of > 10 mJy at 150 MHz for a spectral index steeper than 1. Compared to the 150 MHz flux densities of known HzRGs, this value is close to two orders of magnitude fainter. In the present case of LBDS-Lynx field, deep observations exist at 327, 610 and 1400 MHz, which allowed us to obtain reliable spectral index estimates for sources as faint as 7 mJy at 150 MHz. Using our observations, we have obtained about 100 radio sources with spectral index steeper than 1 having no optical counterparts in the SDSS. The median 150 MHz flux density for these sources is ∼ 110 mJy, which is an order of magnitude fainter than the median flux density at 150 MHz for known HzRGs.

3 OBSERVATION AND DATA ANALYSIS

3.1 GMRT 150 MHz observations

The 150 MHz observations of the LBDS-Lynx field centered at RA=08h41m46s and DEC=+44d46^′ 50^{′′} (J2000) were carried out with the Giant Metrewave Radio Telescope (GMRT) on December 11, 2006 using a bandwidth of 16 MHz, between local midnight to morning in order to reduce the radio frequency interference (RFI). The GMRT consists of 30 antennas, each of 45 meter diameter located 90 km from Pune, India and operates at five frequency bands from 150 MHz to 1450 MHz (Swarup et al. 1991). For determining the flux density scale, standard flux calibrators (3C147

Figure 2. A portion of the 150 MHz image of LBDS field obtained with the GMRT. The rms noise in the image is ∼ 0.7 mJy/beam and the resolution is ∼ 19^{′′} × 15^{′′} with position angle of 27^∘.

and 3C286) were observed and their flux densities at 150 MHz was estimated using the Perley-Taylor scale (Perley & Taylor 1991). From the estimate of median spectral index of the sources in the field (0.78), which was close to the expected value (e.g: Oort, Steemers & Windhorst, 1988), we infer that the error in the flux density scale is ≲ 10% at 150 MHz. The data were recorded in the spectral line mode with 256 channels of 62.5 kHz bandwidth per channel at 150 MHz to minimise the effect of bandwidth smearing. A phase calibrator was observed for five minutes for every 30 minutes of on source observation. The data were analysed using AIPS++ (v1.9;build #1556; see Sirothia 2008, Sirothia et al. 2009). While calibrating the data, bad data points were flagged at various stages. The data for antennas with relatively large errors in antenna-based gain solutions were examined and flagged over certain time ranges. Some baselines were flagged, based on closure errors on the bandpass calibrator. Channel and time-based flagging of the data points corrupted by radio frequency interference (RFI) was done by applying a median filter with a 6σ threshold. Residual errors above 5σ were also flagged after a few rounds of imaging and self-calibration. The final image was made after several rounds of phase self-calibration, and one round of amplitudeand-phase self-calibration, where the data were normalized by the median gain found for the entire data. The primary beam correction was applied to the final image. The final rms noise achieved at 150 MHz near the center of the field in a source free region was ∼ 0.7 mJy/beam with a resolution of ∼ 19^{′′} × 15^{′′} at position angle of 27^∘. A portion of the image is presented in Figure 2.

Deep GMRT 150 MHz observations of LBDS field 5

Figure 3. Coverage of different existing deep observations of LBDS field at 327, 610, 1412 and 1465 MHz with respect to the GMRT field of view. One set of observations at 1412 MHz cover a much smaller area but are deeper compared to another set of observation at 1412 MHz. WENSS, NVSS and FIRST cover the full area of our 150 MHz coverage. They are not indicated in this figure (Also see Table 2)

Table 2. Summary of radio observations and number of radio sources available in the LBDS-Lynx area, within 20% of the primary beam of GMRT at 150 MHz (Figure 3).

Freq. Telescope 1 σ noise No. of Ref. (MHz) (mJy) Sources

153 GMRT 0.7 765 This paper 327 WSRT 0.9 394 Oort88 327 WSRT-WENSS 4 302 Reng97 610 WSRT 0.3 437 WindPvt 1400 VLA-FIRST 0.2 1327 Beck95 1400 VLA-NVSS 0.7 789 Cond98 1412 WSRT 0.2 231 Wind84 1412 WSRT 0.02 349 Oort87 1462 VLA 0.045 139 Wind85 4860 VLA 0.015 59 Donn87 References: Oort88: Oort et al. 1988, Reng97: Rengelink et al. 1997, WindPvt: Windhorst, unpublished data, Beck95: Becker et al. 1995, Cond98: Condon et al. 1998, Wind84: Windhorst et al. 1984, Oort87: Oort 1987, Wind85: Windhorst et al. 1985, Donn87: Donnelly et al. 1987.

3.2 Ancillary radio data

Deep radio observations of this field are available at 327, 610 and 1412 MHz using the WSRT and at 1400 and 4860 MHz with the VLA (See Table 2). The 1412 MHz observations with the WSRT 3 km array have the east-west beam of ∼ 12.5^{′′} and rms noise of 0.12 to 0.2 mJy/beam (Windhorst, Heerde & Katgert, 1984) from a 12 hour observation. The resolution is comparable to that of GMRT at 150 MHz. The second set of observations cover a smaller area of ∼ 0.7 degree^2, but reach a deeper flux density limit of 0.3 mJy (Oort and Windhorst, 1985). A third set of deep observations at 1412 MHz of the region has detected 349 sources down to 0.1 mJy (Oort, 1987). A total of 580 sources are found in the combined 1412 MHz catalogue. Deep observations with the VLA at 1462 MHz were also carried out which yielded a little over 100 sources above a flux density limit of 0.23 mJy (Windhorst et al. 1985). The resolution of this VLA image was ∼ 15^{′′} , comparable to the WSRT resolution at 1412 MHz. The LBDS region was also mapped at 327 MHz using the WSRT with a resolution of about an arc-min. Above a 5 σ limit of 4.5 mJy, a total of 384 sources were found (Oort, Seemers & Windhorst, 1988). The 610 MHz catalog (unpublished) has ∼ 400 sources stronger than 1.3 mJy. The VLA and WSRT observations at 5 GHz were also used, though they cover a small part of the area. Table 2 gives the summary of all available data, and Figure 3 shows the areal overlap with the GMRT observations. However, all these observations combined cover less than 50% of the GMRT 150 MHz area. We also use the WENSS data at 327 MHz and NVSS and FIRST data at 1400 MHz for the entire field.

4 RESULTS AND DISCUSSION

4.1 The 150 MHz source catalog

A catalogue of sources out to the 20% of the peak primary beam response was created with the peak source brightness greater than 6 times the local rms noise value. The details of the source extraction criterion are given in Sirothia et al. (2009). The final catalogue contains about 750 sources above a flux density limit of ∼ 4 mJy. Since the rms is not uniform across the image (rms is higher away from the phase center and also near a few bright sources), the actual completeness limit of this catalog is higher than this limiting value. The median flux density of the catalogue is ∼ 26 mJy. The majority (about two-third) of the sources are unresolved within the resolution of the observation. About 18% of the sources are significantly extended (larger than about 0.5 arcmin). Close inspection of these sources suggests a range of morphology, such as FR-II, FR-I, one sided jets, relic types, etc. Further details on these sources and their properties is beyond the scope of this paper. The mean position offset at 150 MHz with respect to the FIRST position is about -0.019±3.27 arc-sec in RA and -1.61±3.12 arc-sec in DEC. A portion of the table is presented in Table 3 (the full catalogue is available online). Column 1: Source Name; Columns 2-4: RA; Columns 5-7: DEC; Columns 8-17: The flux density at 150 MHz(GMRT), 327 MHz(WSRT), 327 MHz(WENSS), 610 MHz(WSRT), 1412 MHz(WSRT, Windhorst et al. 1984), 1412 MHz(WSRT, Oort et al. 1987), 1400 MHz(NVSS), 1400 MHz(FIRST), 1462 MHz(VLA) and 4860 MHz(VLA) respectively; Column 18: Spectral index from the fit.

The source count reported from this field goes an order of magnitude deeper than earlier 150 MHz surveys (McGilchrist et al. 1990). In Fig. 4 we plot the GMRT differential source count and for comparisons with previous surveys we also plot the source count from 7C survey for the same region (Hales et al. 2007 and references therein). We believe that our 150 MHz sources are dominated by a cosmological population of AGNs.

4.2 Spectral index estimates

The counterparts for the 150 MHz sources at higher radio frequencies were searched within a 20^{′′} radius from the 150 MHz position. In addition to the published deep observations of the LBDS field at 327, 610, 1412, 1462 and 4860

6 C. H. Ishwara-Chandra et al.

Table 3. Sample table of GMRT 150 MHz sources (The complete table is available in online version). The spectral index is from the blind straightline fit, which may not be valid for a small fraction (∼ 3%) of sources.

NAME RA (J2000) DEC (J2000) S150 S327 SW EN SS S610 S1412a S1412b SN V SS SF IRST S1462 S4860 α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18)

GMRTJ083035+454329 08 30 35.7 45 43 29.6 11342.3 − 3049.0 − − − 614.4 608.3 − − 1.48 GMRTJ083752+445024 08 37 52.9 44 50 24.6 11158.2 4561.5 4662.0 2890.0 1519.2 − 1528.9 1139.8 − − 1.01 GMRTJ084639+462141 08 46 39.7 46 21 41.9 3201.8 1299.4 1303.0 − − − 362.3 380.0 − − 1.03 GMRTJ084737+461405 08 47 37.6 46 14 5.3 2819.6 1028.8 1043.0 − − − 262.1 217.3 − − 1.16 GMRTJ084034+465112 08 40 34.3 46 51 12.8 2225.0 − 928.0 − − − 287.8 297.6 − − 0.94 GMRTJ084530+461035 08 45 30.6 46 10 35.5 47.1 28.0 19.0 − − − 7.8 7.9 − − 0.80

Figure 4. LogN-LogS of the 150 MHz sources. We present sources extending to an order of magnitude deeper than previous surveys. At higher flux densities we are consistent with the 7C survey at this frequency (Hales et al. 2007). The source counts for 7C survey are shown for the same region as that covered by the GMRT.

MHz, we used the WENSS catalog at 325 MHz and the NVSS and FIRST catalogs at 1400 MHz to obtain the spectral index of sources found at 150 MHz. Since the aim of the project is to search for steep spectrum sources, the spectral indices were computed using the GMRT 150 MHz catalog as the primary catalog. The spectral index was computed if a counterpart was found at 610 MHz or at any of the higher frequencies. If the counterpart was seen only at 327 MHz, the spectral index was not computed, since the two frequencies are quite close by and the error in the spectral index would be large. Nonetheless, if the source was detected at 327 MHz either in WENSS or at the deep observation of this field at 327 MHz, this value of flux was also used to fit the spectrum along with other available measurements. The typical error on the spectral index estimate was about 0.1, or better. A small fraction of the sources (3%) do not fit well with a straight spectrum and these are mostly sources with spectral turnover. Analysis of these sources is beyond the scope of this paper. The spectral index distribution is presented in Fig. 6. The full table is available online.

A total of 639 sources out of 765 (83%) have spectral index determined. The remaining 17% sources are mostly weak radio sources with a median flux density of ∼ 9 mJy, or fall in the regions where deep observations at higher frequencies do not exist. The median spectral index of the sample is 0.78 (Fig. 5). This is in good agreement with the similar measurements available in the literature (e.g., Oort, Steemers and Windhorst, 1988; Gruppioni et al. 1997). About 15 sources have spectra index flatter than 0.1, 100 sources have spectra

Figure 5. Histogram of spectral index distribution of all sources with spectral index measurements. The median value of spectral index is 0.78.

flatter than 0.5, 157 have a spectral index steeper than 1, and about 20 have spectral index steeper than 1.3. The steep spectrum sources are of primary interest in this work, and we discuss these sources in the next section. Our sample of steep spectrum sources consists of sources with spectra steeper than 1 (and not 1.3 as used by several authors earlier) for the following reasons; (a) Despite the fact that most previous searches are limited to sources with spectral index steeper than 1.3, the median spectral index of known HzRGs is 1.31. (b) Though Klamer et al. (2006) have shown that the spectra for the majority of HzRGs are straight over a large frequency range, evidence for spectral curvature cannot be ruled out completely (Bornancini et al. 2007). This means that at frequencies as low as 150 MHz, a higher cut-off in the spectral index will translate into even higher cutoff at the rest-frame of high-redshift objects. (c) From the P − α relation (Mangalam & Gopal-Krishna, 1995; Blundell et al. 1999), sources which are less powerful (at low radio frequencies) can have marginally flatter spectra. Since we are aiming to detect HzRGs that are 10 to 100 times less luminous than the known HzRGs, we could miss HzRGs if we adopt a steep spectral index cut-off of 1.3. Finally, our catalogue will be cross-checked against SDSS for possible optical counterparts, which would naturally eliminate any nearby objects that have steeper spectral index for any other reason (e.g: synchrotron losses in galaxy clusters). Therefore, we adopt a spectral index cutoff of 1, which yields a sample of 157 radio sources selected at 150 MHz, which are then compared with available deep optical observations.

Deep GMRT 150 MHz observations of LBDS field 7

Figure 7. Radio spectra of a few steep spectrum sources without an optical counterpart in SDSS. Note that for majority of the sources, the spectrum is straight over the frequency range from 150 to 1400 MHz.

Figure 6. The spectral index distribution of sources detected at 150 MHz (S_ν ∝ ν^{−α}). The spectral index was computed whenever a counterpart was found at 610 MHz or higher frequencies, irrespective of detection at 325 MHz. The dashed line shows the spectral index limit corresponding to five sigma limit of FIRST. There is a weak trend indicating that the fainter sources tend to have flatter spectra.

4.3 Optical Counterparts in the Sloan Digital Sky Survey (SDSS)

The position accuracy at 150 MHz is not good enough to search for optical counterparts in SDSS. We have cross matched the sample of 157 sources, with spectral index steeper than 1 with VLA FIRST survey (Becker et al 1995). The position accuracy in FIRST survey is better than an arcsecond. If the counterpart is seen in FIRST, we have taken the position from FIRST survey to obtain better accuracy. When multiple components were seen in FIRST, the FIRST images were inspected and the position of the core (or the centroid in case of a clear compact double lobe structure) was chosen. In a couple of cases, the radio structures were such that there was one unresolved compact component and a second component which is extended. In such cases, we have taken the position of the unresolved component. In this procedure, it is possible that we have missed likely counterparts in some cases. Among the 157 sources, 8 sources did not have counterparts in FIRST and hence the 150 MHz position was used to cross match with SDSS.

We positionally matched each steep spectrum source position with the photometric object catalog (PhotoObjAll) from the most recent (DR7) release of the Sloan Digital Sky

8 C. H. Ishwara-Chandra et al.

Figure 8. The distribution of photometric redshifts of the steep spectrum radio sources with optical counterparts in the SDSS.

Survey (SDSS; Abazajian et al. 2009). 59 radio sources from this sample had at least one SDSS primary object within 6 arcsec (38% identification). The remaining 98 sources had no optical counterpart in SDSS within 6^{′′} radius and these are listed in Table 4. This radio source optical identification fraction is similar to that found by Ivezic et al. (2002) (30%) by cross-matching FIRST survey sources with SDSS.

4.3.1 Photometric redshifts

The SDSS Catalog Archive Server (CAS) includes photometric redshift estimates for most galaxies with flux measurements in multiple SDSS filters. Two independent methods have been used to estimate the photometric redshift 1. A template fitting method (Csabai et al. 2003) with outputs listed in the table photoz of the CAS and 2. A neural network based method (Collister & Lahav 2004) with outputs listed in table photoz2 of the CAS. The neural network based technique suffers from larger uncertainties and biases for faint galaxies, because training examples with known spectroscopic redshifts are not numerous enough for these objects. We, therefore, chose to use only the photometric redshifts obtained by the template fitting method. 44 of our 157 steep spectrum radio sources have a total of 57 potential optical counterparts with listed photometric redhifts. Note that the number of optical counterparts is greater than the number of steep spectrum sources, because a few radio sources have more than one galaxy with photometric redshift lying within the 6 arcsec search radius. The photometric redshifts range from 0.02 to 0.75. The redshift histogram for these galaxies is shown in Fig 8.

4.4 Sample of steep spectrum sources

We present the sample of steep spectrum radio sources which do not have SDSS counterparts in Table 4. The median 150 MHz flux density for these sources is ∼ 100 mJy, which is more than an order of magnitude fainter than the median flux density at 150 MHz for known HzRGs (section 2). If we further divide the sample into two parts, one with 1 < α < 1.3 and α > 1.3, we find that the fraction of sources without

Table 4. Steep spectrum sources which do not have counterparts in SDSS (see section 4.3). The coordinates given are from the GMRT 150 MHz observations and the flux density (S_{150} ) is in mJy.

NAME RA DEC S_{150} α

GMRTJ082947+442036 08 29 47.7 44 20 36.5 975.8 1.18 GMRTJ083132+450742 08 31 32.4 45 07 42.8 55.9 0.99 GMRTJ083156+435728 08 31 56.3 43 57 28.1 1054.0 1.14 GMRTJ083212+451934 08 32 12.3 45 19 34.2 90.8 1.06 GMRTJ083245+450716 08 32 46.0 45 07 16.2 75.5 1.27 GMRTJ083349+432020 08 33 49.3 43 20 20.4 503.1 1.37 GMRTJ083405+453443 08 34 05.3 45 34 43.0 1776.4 1.08 GMRTJ083421+441057 08 34 21.2 44 10 57.7 905.8 1.17 GMRTJ083507+453628 08 35 07.7 45 36 28.6 251.2 1.25 GMRTJ083521+453305 08 35 22.0 45 33 05.3 416.8 1.06 GMRTJ083527+440950 08 35 27.3 44 09 50.3 596.5 1.21 GMRTJ083527+440004 08 35 27.4 44 00 04.0 94.2 1.08 GMRTJ083548+450944 08 35 48.8 45 09 44.5 12.4 1.05 GMRTJ083620+444826 08 36 20.7 44 48 26.3 17.2 1.06 GMRTJ083628+430053 08 36 29.0 43 00 53.0 64.2 1.19 GMRTJ083632+450605 08 36 32.8 45 06 05.4 41.3 1.10 GMRTJ083701+435554 08 37 01.9 43 55 54.5 12.6 1.13 GMRTJ083714+462908 08 37 14.8 46 29 08.9 18.2 1.05 GMRTJ083757+443443 08 37 57.0 44 34 43.4 378.6 1.06 GMRTJ083808+441910 08 38 08.5 44 19 10.1 39.6 1.29 GMRTJ083814+424248 08 38 14.0 42 42 48.2 20.8 1.01 GMRTJ083816+460632 08 38 16.5 46 06 32.7 39.3 1.04 GMRTJ083825+432522 08 38 25.6 43 25 22.2 315.1 1.37 GMRTJ083831+443808 08 38 31.5 44 38 08.2 21.2 1.51 GMRTJ083833+461651 08 38 33.8 46 16 51.6 53.3 1.53 GMRTJ083840+460825 08 38 40.5 46 08 25.6 618.0 1.27 GMRTJ083859+424414 08 38 59.3 42 44 14.4 60.5 1.35 GMRTJ083934+463534 08 39 34.3 46 35 34.0 924.1 1.21 GMRTJ083957+432301 08 39 57.7 43 23 01.1 225.8 1.10 GMRTJ084005+424657 08 40 05.8 42 46 57.8 24.2 1.20 GMRTJ084012+432511 08 40 12.3 43 25 11.8 61.9 1.07 GMRTJ084013+432319 08 40 13.5 43 23 19.8 66.8 1.20 GMRTJ084021+431928 08 40 21.9 43 19 28.4 62.1 1.16 GMRTJ084036+443132 08 40 36.6 44 31 32.2 132.7 1.02 GMRTJ084045+460817 08 40 45.0 46 08 17.2 45.5 1.10 GMRTJ084046+460719 08 40 46.3 46 07 19.9 197.1 1.01 GMRTJ084105+445045 08 41 05.7 44 50 45.8 855.8 1.14 GMRTJ084157+434105 08 41 57.5 43 41 05.6 86.2 1.02 GMRTJ084211+445404 08 42 11.7 44 54 04.8 147.4 1.21 GMRTJ084213+440637 08 42 13.8 44 06 37.7 9.2 1.00 GMRTJ084220+424651 08 42 20.3 42 46 51.6 158.4 1.07 GMRTJ084223+425532 08 42 23.8 42 55 32.1 100.0 1.19 GMRTJ084242+453312 08 42 42.3 45 33 12.8 80.1 0.99 GMRTJ084251+464505 08 42 51.5 46 45 05.1 198.5 1.04 GMRTJ084300+453423 08 43 00.7 45 34 23.8 234.3 1.15 GMRTJ084306+445552 08 43 06.8 44 55 52.1 191.7 1.16 GMRTJ084311+433104 08 43 11.0 43 31 04.7 118.3 1.06 GMRTJ084315+435630 08 43 15.8 43 56 30.9 124.5 1.00 GMRTJ084322+461433 08 43 22.0 46 14 33.0 169.2 1.08 GMRTJ084332+461703 08 43 32.4 46 17 03.3 192.8 1.03 GMRTJ084402+462616 08 44 02.0 46 26 16.5 62.6 1.01 GMRTJ084412+451559 08 44 12.4 45 15 59.7 38.1 1.04 GMRTJ084415+430136 08 44 15.8 43 01 36.3 49.2 1.31 GMRTJ084420+445802 08 44 20.4 44 58 02.3 29.0 0.99 GMRTJ084437+442558 08 44 37.2 44 25 58.5 84.0 1.53 GMRTJ084505+442543 08 45 05.5 44 25 43.4 28.0 1.05 GMRTJ084515+431304 08 45 15.1 43 13 04.7 129.1 0.99 GMRTJ084519+434953 08 45 19.9 43 49 53.1 342.7 1.04 GMRTJ084522+434350 08 45 22.6 43 43 50.0 219.9 0.99 GMRTJ084527+465014 08 45 27.6 46 50 14.6 1439.6 1.06 GMRTJ084528+440732 08 45 28.7 44 07 32.4 141.8 1.48

© 2009 RAS, MNRAS 000, 1–??

Deep GMRT 150 MHz observations of LBDS field 9

Figure 9. A few extended sources among the steep spectrum source catalogue. The GMRT 153 MHz and VLA 1400 MHz (FIRST) image pairs are arranged as follows: Top line GMRTJ083349+432020 and GMRTJ083405+453443; second line GMRTJ083507+453628 and GMRTJ083833+461651; third line GMRTJ084105+445045 and the image at the bottom is GMRTJ084711+454015

10 C. H. Ishwara-Chandra et al.

Table 4. Contd

NAME RA DEC S_{150} α

GMRTJ084533+455835 08 45 33.2 45 58 35.0 23.9 1.06 GMRTJ084542+461535 08 45 42.9 46 15 35.9 753.3 1.11 GMRTJ084559+425705 08 45 59.6 42 57 05.9 191.1 1.06 GMRTJ084616+463234 08 46 16.2 46 32 34.3 150.3 0.99 GMRTJ084627+453128 08 46 27.2 45 31 28.7 233.9 1.15 GMRTJ084635+455030 08 46 35.5 45 50 30.2 19.4 1.01 GMRTJ084644+432903 08 46 44.7 43 29 03.1 371.8 1.06 GMRTJ084654+455935 08 46 54.4 45 59 35.7 219.7 1.11 GMRTJ084711+454015 08 47 11.5 45 40 15.9 1704.3 1.04 GMRTJ084728+430551 08 47 28.1 43 05 51.9 124.0 1.09 GMRTJ084730+440822 08 47 30.5 44 08 22.5 63.6 1.11 GMRTJ084737+461405 08 47 37.5 46 14 05.2 2819.6 1.16 GMRTJ084742+451726 08 47 42.4 45 17 26.8 11.0 1.07 GMRTJ084743+431711 08 47 43.7 43 17 11.2 17.4 1.01 GMRTJ084747+451016 08 47 47.7 45 10 16.7 196.9 1.06 GMRTJ084748+441228 08 47 48.2 44 12 28.7 50.3 1.08 GMRTJ084755+445359 08 47 55.7 44 53 59.3 143.0 1.07 GMRTJ084804+425728 08 48 04.3 42 57 28.0 90.4 1.16 GMRTJ084811+460025 08 48 11.7 46 00 25.3 37.5 1.61 GMRTJ084824+432240 08 48 24.5 43 22 40.2 132.3 1.23 GMRTJ084842+455357 08 48 42.3 45 53 57.4 175.5 1.04 GMRTJ084901+445049 08 49 01.2 44 50 49.3 18.8 1.88 GMRTJ084938+442311 08 49 38.6 44 23 11.5 686.3 1.09 GMRTJ084943+453750 08 49 43.1 45 37 50.5 12.8 1.28 GMRTJ085018+432248 08 50 18.2 43 22 48.3 153.7 1.19 GMRTJ085019+451435 08 50 19.4 45 14 35.1 18.7 1.34 GMRTJ085028+445522 08 50 28.3 44 55 22.3 108.6 1.07 GMRTJ085038+445637 08 50 38.0 44 56 37.5 41.9 1.45 GMRTJ085044+454559 08 50 44.6 45 45 59.0 37.5 1.11 GMRTJ085052+460440 08 50 52.9 46 04 40.0 110.6 1.27 GMRTJ085132+441952 08 51 32.1 44 19 52.4 774.6 1.15 GMRTJ085157+453448 08 51 57.9 45 34 48.8 66.5 1.08 GMRTJ085202+435054 08 52 02.6 43 50 54.4 24.1 1.13 GMRTJ085308+441109 08 53 08.3 44 11 09.0 92.6 1.09 GMRTJ085322+450357 08 53 22.3 45 03 57.3 907.7 1.01 GMRTJ085330+452256 08 53 30.3 45 22 56.5 162.1 1.13 GMRTJ085406+445052 08 54 06.3 44 50 52.5 17.1 1.09

identification in SDSS is 63% for sources with 1 < α < 1.3 and 68% for sources with α > 1.3. Although this difference is not statistically significant, the trend of increased fraction of sources without identification in SDSS for sources with steeper spectra goes in the expected direction.

A few examples of the radio spectra among these sources are given in Figure 7. One of the sources with steepest spectrum (α = 1.53; GMRT084437+442558) has measurements at 150, 327, 1412 and 4860 MHz. We have inspected the spectra where three or more frequency measurements are available for signatures of spectral curvature. There is no clear indication of spectral curvature in most of the sources. Since the frequency range is just one order of magnitude, higher frequency radio data are needed to further investigate the question of spectral curvature. The absence of spectral curvature in these data is consistent with the results of Klamer et al (2006), also argued that the spectral curvature is unlikely to be the reason for steepening of the radio spectra at high-redshifts.

One of the steep spectrum source without SDSS counterpart (GMRTJ084533+455835), is unresolved at 150 MHz, but resolves into a clear compact FRII source of about 8 arcsec size in VLA FIRST. Using the 150 MHz flux density and FRI/FRII break luminosity, we estimate that this source should be at a redshift of ∼ 2 or higher (for its luminosity to be above the FRI/FRII break).

4.5 Notes on individual sources:

Among the 98 steep spectrum sources that do not have counterparts in SDSS, 68 are unresolved sources and have only one component in 1.4 GHz FIRST as well. Among the remaining 30 sources, we discuss those which show significant structure, many of which are unlikely to be at high-redshift (Figure 9), but remained unidentified in SDSS either due to confusion in getting the correct radio component and position or due to dust obscuration in the host galaxy. GMRTJ083349+432020: This is a well defined double radio source at 150 MHz as well as in FIRST. The lobes appear to be of FR-II type, however they are not compact, and seem to have ’diffused out’. Since the core is not visible, the SDSS identification is difficult. The spectral index of this source is 1.37. From the relaxed morphology of the lobes, this could be an example of ’dead AGN’, as highlighted recently using 74 MHz and NVSS data (Dwarakanath & Kale, 2009). GMRTJ083405+453443: The 150 MHz map does not reveal any structure. However, the FIRST image shows interesting ’one-sided jet’ morphology. There is a compact component appearing like a core at the north-east end and extended emission towards the south-west resembling a lobe, but lacks clear hotspot near the edge. The plume like structure to the right is also unusual. This is an interesting source worth further high-resolution observations to understand the unusual morphology.

GMRTJ083507+453628: The structure at 150 MHz just resolves into two lobes, which are mostly resolved out in FIRST. This indicates that the lobes do not have compact hotspots. This steep spectrum is suggestive of the lobes belonging to ’dead AGN’.

GMRTJ083833+461651: This is one of the steepest spectrum source in the sample with the spectral index of 1.53. The 150 MHz images does not resolve two lobes clearly. The FIRST image shows three structures. However, the central emitting region does not appear like a core. It is possible that the two emitting regions on either side are a pair of lobes, and the central component is an unrelated source. GMRTJ084105+445045: An asymmetric triple with a bright core at 150 MHz? The FIRST image resolves this into a linear double and a likely unrelated source. At first sight, this double radio source resembles the ’double-double’ morphology, however closer inspection reveals that the inner pair of lobes is more relaxed than the outer pair, which is inconsistent with the standard double-double morphology (Schoenmakers et al. 2000).

GMRTJ084711+454015: Appears to be a double at 150 MHz. The lobes on either side showed extended diffuse emission. The FIRST image clearly resolves the eastern lobe into a diffuse ’relic’ type morphology and the west lobe into a head-tail looking structure. There is no known cluster in this region. The spectral index of diffuse region alone is 1.2

5 CONCLUDING REMARKS

The radio spectral-index redshift correlation is the most efficient method used to detect high-redshift radio galaxies. Up

Deep GMRT 150 MHz observations of LBDS field 11

to now, about 45 radio galaxies beyond redshift of 3 have been discovered using this method. We have shown that this known high-z population is just the tip of the iceberg, in the sense that they are the most luminous objects in this class. Radio sources which are 10 to 100 times less luminous than these are yet to be discovered, and these are essential to fully understand the cosmological evolution of radio galaxies. We have initiated a major programme to search for steep spectrum radio sources with the GMRT with the aim to detect high-redshift radio galaxies of moderate luminosity. The fields for this programme are carefully chosen such that extensive data already exist at higher radio frequencies and deep optical imaging and/or spectroscopy is also available for most of the fields.

Here we have presented the results from deep 150 MHz low frequency radio observations with the Giant Metrewave Radio Telescope (GMRT), India reaching an rms noise of of ∼ 0.7 mJy/beam and a resolution of ∼ 20^{′′} . Further, several deep observations exist, mainly at 327, 610 and 1412 MHz for this field. The radio spectral index analysis of the sources in the field was done using these deep observations and also using the WENSS at 325 MHz and the NVSS and FIRST at 1400 MHz. We have demonstrated that this GMRT survey can search for high-redshift radio galaxies more than an order of magnitude fainter in luminosity compared to most of the known HzRGs. We provide a sample of about 100 candidate HzRGs with spectral index steeper than 1 and no optical counterpart to the SDSS sensitivity limits. A significant fraction of the sources are compact, and are strong candidates for high-redshift radio galaxies. These sources will need to be followed up at optical and near-infrared bands to estimate their redshifts.

ACKNOWLEDGMENTS

We thank the referee for insightful suggestions and Gopal- Krishna for comments on the manuscript. GMRT is operated by the National Centre for Radio Astrophysics of the Tata Institute of Fundamental Research. This research has made use of the NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration. Funding for the SDSS and SDSS-II has been provided by the Alfred P. Sloan Foundation, the Participating Institutions, the National Science Foundation, the U.S. Department of Energy, the National Aeronautics and Space Administration, the Japanese Monbukagakusho, the Max Planck Society, and the Higher Education Funding Council for England. The SDSS Web Site is http://www.sdss.org/. The SDSS is managed by the Astrophysical Research Consortium for the Participating Institutions. The Participating Institutions are the American Museum of Natural History, Astrophysical Institute Potsdam, University of Basel, University of Cambridge, Case Western Reserve University, University of Chicago, Drexel University, Fermilab, the Institute for Advanced Study, the Japan Participation Group, Johns Hopkins University, the Joint Institute for Nuclear Astrophysics, the Kavli Institute for Particle Astrophysics and Cosmology, the Korean Scientist Group, the Chinese Academy of Sciences (LAMOST), Los Alamos National Laboratory, the Max-Planck-Institute for Astronomy (MPIA), the Max- Planck-Institute for Astrophysics (MPA), New Mexico State University, Ohio State University, University of Pittsburgh, University of Portsmouth, Princeton University, the United States Naval Observatory, and the University of Washington.

REFERENCES

Abazajian K. N. et al., 2009, ApJS, 182, 543 Athreya R. M., Kapahi V. K., McCarthy P. J., van Breugel W., 1998, A&A, 329, 809 Becker R. H., White R. L., Helfand D. J., 1995, AJ, 450, 559 Bennett et al., 2003, ApJS, 148, 1 Best P. N., Longair M. S., Rottgering H. J. A., 1998, MNRAS, 295 549.

Blumenthal G., Miley G., 1979, A&A, 18, 13 Blundell K. M., Rawlings S., Willott C. J., 1999, AJ, 117, 677 Bornancini C. G., De Breuck C., de Vries W., Croft S., van Breugel W., Rttgering H., Minniti D., 2007, MNRAS, 378, 551 Brookes M. H., Best P. N., Rengelink R., Rttgering H. J. A., 2006, MNRAS, 366, 1265 Bryant J. J., Johnston H. M., Broderick J. W., Hunstead R. W., De Breuck C., Gaensler B. M., 2009, MNRAS, 395, 1099 Caccianiga A., Maccacaro T., Wolter A., Della Ceca R., Gioia I.

M., 2000, A&AS, 144, 247 Carilli C. L., Rottgering H. J. A., van Ojik R., Miley G. K., van Breugel W. J. M., 1997, ApJS, 109, 1 Chambers K. C., Miley G. K., van Breugel W. J. M., Bremer M.

A. R., Huang J.-S., Trentham N. A., 1996, ApJS, 106, 247 Collister A. A., Lahav O., 2004, PASP, 116, 345 Condon J. J., Cotton W. D., Greisen E. W., Yin Q. F., Perley R.

A., Taylor G. B., Broderick J. J., 1998, AJ, 115, 1693 Cruz M. J., Jarvis M. J., Rawlings S., Blundell K. M., 2007, MNRAS, 375, 1349 Cruz M. J., Jarvis M. J., Blundell K. M., Rawlings S., Croft S., Klckner H., McLure R. J., Simpson C., Targett T. A., Willott C. J., 2006, MNRAS, 373, 1531 Csabai I., et al., 2003, AJ, 125, 580 De Breuck C., van Breugel W., Rttgering H. J. A., Miley G., 2000, A&AS, 143, 303.

De Breuck C., van Breugel W., Rttgering H., Stern D., Miley G., de Vries W., Stanford S. A., Kurk J., Overzier R., 2001, AJ, 121, 1241 De Breuck C., van Breugel W., Stanford S. A., Rttgering H., Miley G., Stern D., 2002, AJ, 123, 637 De Breuck C., Hunstead R. W., Sadler E. M., Rocca-Volmerange B., Klamer I., 2004, MNRAS, 347, 837 De Breuck C., Klamer I., Johnston H., Hunstead R. W., Bryant J., Rocca-Volmerange B., Sadler E. M., 2006, MNRAS, 366, 58 Donnelly R. H., Partridge R. B., Windhorst R. A., 1987, ApJ, 321, 94 Dwarakanath K. S., Kale R., 2009, ApJL, 698, 163 Fanaroff B. L., and Riley J. M, 1974, MNRAS, 167P, 31 Gopal-Krishna., Steppe, H., 1981, A&A, 101, 315 Gruppioni C., Zamorani G., de Ruiter H. R., Parma P., Mignoli M., Lari C., 1997, MNRAS, 286, 470 Hales S. E. G., Riley J. M., Waldram E. M., Warner P. J., Baldwin J. E., 2007, MNRAS, 382, 1639 Ivezic Z., et al., 2002, AJ, 124, 2364 Jarvis M. J., Rawlings S., Willott C. J., Blundell K. M., Eales S., Lacy M., 2001, MNRAS, 327, 907 Jarvis M. J., Teimourian H., Simpson C., Smith D. J. B., Rawlings S., Bonfield D., 2009, MNRAS, 398L, 83

12 C. H. Ishwara-Chandra et al.

Klamer I. J., Ekers R. D., Bryant J. J., Hunstead R. W., Sadler E. M., De Breuck C., 2006, MNRAS, 371, 852 Kopylov A. I., Goss W. M., Pariski Yu. N., Soboleva N. S., Verkhodanov O. V., Temirova A. V., Zhelenkova O. P., 2006, AstL, 32, 433.

Kronberg P. P., Bernet M. L., Miniati F., Lilly S. J., Short M. B., Higdon D. M., 2008, ApJ, 676, 70 Lacy M., Miley G., Rawlings S., Saunders R., Dickinson M., Garrington S., Maddox S., Pooley G., Steidel C. C., Bremer M. N., and 4 coauthors, 1994, MNRAS, 271, 504 Lacy M, Rawlings Steve H., Gary J., Bunker A. J., Ridgway S.

E., Stern D., 1999, MNRAS, 308, 1096 Lilly S. J., 1988, ApJ, 333, 161 Mangalam A. V., Gopal-Krishna., 1995, MNRAS, 275, 976 Mauch T., Murphy T., Buttery H. J., Curran J., Hunstead R.

W., Piestrzynski B., Robertson J. G., Sadler E. M., 2003, MNRAS, 342, 1117 McCarthy P. J., Kapahi V. K., van Breugel W., Subrahmanya C.

R., 1990, AJ, 100, 1014 McCarthy P. J., Kapahi V. K., van Breugel W, Persson S. E., Athreya R, Subrahmanya C. R., 1996, ApJS, 107, 19 McGilchrist M. M.; Baldwin J. E.; Riley J. M.; Titterington D.

J., Waldram E. M.; Warner P. J., 1990, MNRAS, 246, 110 Miley G, K., de Breuck C., 2008, A&ARv, 15, 67 Oort M. J. A., Windhorst R. A., 1985, A&A, 145, 405 Oort M. J. A., 1987, A&AS, 71, 221 Oort M. J. A., Steemers W. J. G., Windhorst R. A., 1988, A&AS, 73, 103 Pedani., 2003, NewA, 8, 805 Pentericci L., Van Reeven W., Carilli C. L., Rttgering H. J. A., Miley G. K., 2000, A&AS, 145, 121.

Prez-Torres M.-A., De Breuck C., 2005, MNRAS, 363L, 41 Perley R. A., Taylor G. B., 1991, AJ 101, 1623 Rawlings S., Eales S., Warren S., 1990, MNRAS, 243P, 14 Rawlings S., Lacy M., Blundell K. M., Eales S. A., Bunker A. J., Garrington S. T., 1991, Natur, 383, 502 Rengelink R. B., Tang Y., de Bruyn A. G., Miley G. K., Bremer M. N., Rottgering H. J. A., Bremer M. A. R., 1997, A&AS, 124, 259 Rottgering H. J. A., Lacy M., Miley G. K., Chambers K. C., Saunders R., 1994, A&AS, 108, 79 Rottgering H. J. A., van Ojik R., Miley G. K., Chambers K. C., van Breugel W. J. M., de Koff S., 1997, A&A, 326, 505 Schoenmakers A. P., de Bruyn A. G., Rttgering H. J. A., van der Laan H., Kaiser C. R., 2000, MNRAS, 315, 371 Sirothia S. K., 2008, PhD Thesis, TIFR.

Sirothia S. K., Saikia D. J., Ishwara-Chandra C. H., and Kantharia N. G., 2009, MNRAS, 392, 1403 Stern D., Dey A., Spinrad H., Maxfield L., Dickinson M., Schlegel D., Gonzlez R. A., 1999, AJ, 117, 1122 Swarup G., Ananthakrishnan S., Kapahi V. K., Rao A. P., Subrahmanya C. R., Kulkarni V. K., 1991, Current Science, 60, 95. Tielens A. G. G. M., Miley G. K., Willis A. G., 1979, A&AS, 35, 153.

van Breugel W, De Breuck C, Stanford S. A., Stern D, Rottgering H, Miley G., 1999, ApJ, 518L, 61 Villani D., di Serego Alighieri S., 1999, A&AS, 135, 299 Waddington I., Dunlop J. S., Peacock J. A., Windhorst R. A., 2001, MNRAS, 328, 882 Windhorst R. A., van Heerde G. M., Katgert P., 1984, A&AS, 58, 1 Windhorst R. A., Miley G. K., Owen F. N., Kron R. G., Koo D.

C., 1985, ApJ, 289, 494

Deep GMRT 150 MHz observations of LBDS field 13

Table 5. Table of GMRT 150 MHz sources (see also Table 3). Column 1: Source Name; Columns 2-4: RA; Columns 5-7: DEC; Columns 8-17: The flux density at 150 MHz(GMRT), 327 MHz(WSRT), 327 MHz(WENSS), 610 MHz(WSRT), 1412 MHz(WSRT, Windhorst et al. 1984), 1412 MHz(WSRT, Oort et al. 1987), 1400 MHz(NVSS), 1400 MHz(FIRST), 1462 MHz(VLA) and 4860 MHz(VLA) respectively; Column 18: Spectral index from the blind straightline fit, which may not be valid for a small fraction (∼ 3%) of sources.

NAME RA (J2000) DEC (J2000) S150 S327 SW EN SS S610 S1412a S1412b SN V SS SF IRST S1462 S4860 α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ083035+454329 08 30 35.7 45 43 29.6 11342.3 − 3049.0 − − − 614.4 608.3 − − 1.48 GMRTJ083752+445024 08 37 52.9 44 50 24.6 11158.2 4561.5 4662.0 2890.0 1519.2 − 1528.9 1139.8 − − 1.01 GMRTJ084639+462141 08 46 39.7 46 21 41.9 3201.8 1299.4 1303.0 − − − 362.3 380.0 − − 1.03 GMRTJ084737+461405 08 47 37.6 46 14 5.3 2819.6 1028.8 1043.0 − − − 262.1 217.3 − − 1.16 GMRTJ084034+465112 08 40 34.3 46 51 12.8 2225.0 − 928.0 − − − 287.8 297.6 − − 0.94 GMRTJ083405+453443 08 34 5.3 45 34 43.0 1776.4 641.7 663.0 335.4 − − 197.6 168.8 − − 1.08 GMRTJ084711+454015 08 47 11.6 45 40 15.9 1704.3 580.0 569.0 378.3 − − 216.6 177.7 − − 1.04 GMRTJ084527+465014 08 45 27.7 46 50 14.7 1439.6 − 515.0 − − − 144.2 145.6 − − 1.06 GMRTJ083116+455852 08 31 16.8 45 58 52.5 1438.4 − 491.0 − − − 111.4 106.6 − − 1.18 GMRTJ083540+454141 08 35 40.3 45 41 41.1 1305.6 441.6 470.0 261.3 − − 142.5 139.8 − − 1.05 GMRTJ084512+432322 08 45 12.9 43 23 22.5 1225.0 485.9 489.0 298.1 − − 169.7 152.3 − − 0.95 GMRTJ084037+464716 08 40 37.1 46 47 16.6 1212.4 − 585.0 − − − 194.8 202.0 − − 0.82 GMRTJ083156+435728 08 31 56.3 43 57 28.1 1054.0 328.7 337.0 − − − 93.6 91.2 − − 1.14 GMRTJ084213+451229 08 42 13.1 45 12 29.0 1041.7 429.6 466.0 253.3 135.0 − 132.6 133.3 113.3 − 0.94 GMRTJ082947+442036 08 29 47.7 44 20 36.6 975.8 − 310.0 − − − 78.0 71.9 − − 1.18 GMRTJ083422+430325 08 34 22.6 43 3 25.1 924.3 − 438.0 − − − 175.0 135.3 − − 0.81 GMRTJ083934+463534 08 39 34.3 46 35 34.0 924.1 310.9 300.0 − − − 67.8 64.0 − − 1.21 GMRTJ085309+441015 08 53 9.4 44 10 15.8 922.2 294.9 296.0 146.8 − − 50.4 52.9 − − 1.31 GMRTJ085322+450357 08 53 22.4 45 3 57.3 907.7 358.4 369.0 197.1 − − 97.6 103.3 − − 1.01 GMRTJ083421+441057 08 34 21.2 44 10 57.8 905.8 331.5 316.0 142.4 − − 72.5 72.3 − − 1.17 GMRTJ083859+432319 08 38 59.4 43 23 19.7 860.2 84.6 290.0 − − − 83.9 72.4 − − 1.15 GMRTJ084105+445045 08 41 5.8 44 50 45.8 855.8 264.0 269.0 155.5 84.0 − 80.6 70.3 37.7 − 1.14 GMRTJ083555+440107 08 35 55.9 44 1 7.5 835.8 266.2 286.0 131.5 − − 63.7 55.1 − − 1.22 GMRTJ084843+461033 08 48 43.4 46 10 33.2 823.7 308.3 314.0 − − − 107.2 89.6 − − 0.98 GMRTJ085132+441952 08 51 32.1 44 19 52.4 774.6 232.3 252.0 133.3 62.6 48.8 63.6 63.5 − − 1.15 GMRTJ084543+461536 08 45 43.0 46 15 36.0 753.3 271.3 268.0 − − − 71.2 62.6 − − 1.11 GMRTJ084433+455424 08 44 33.7 45 54 24.0 724.7 284.4 292.0 124.6 − − 105.7 102.3 − − 0.93 GMRTJ083637+440107 08 36 37.6 44 1 7.5 717.9 321.8 333.0 224.1 − − 130.2 139.3 − − 0.76 GMRTJ084938+442311 08 49 38.7 44 23 11.6 686.3 245.1 262.0 137.0 58.8 62.9 59.9 57.0 52.9 − 1.09 GMRTJ083112+434157 08 31 12.0 43 41 57.3 674.3 − 319.0 − − − 137.2 125.9 − − 0.74 GMRTJ083347+451533 08 33 47.2 45 15 33.1 642.9 295.1 322.0 244.0 − − 116.1 124.4 − − 0.74 GMRTJ083710+450651 08 37 10.8 45 6 51.8 633.6 247.4 264.0 143.3 64.4 − 62.7 62.1 − − 1.03 GMRTJ084246+455725 08 42 46.9 45 57 25.0 627.8 247.0 258.0 128.7 − − 69.5 71.4 − − 1.01 GMRTJ083840+460825 08 38 40.5 46 8 25.6 618.0 203.7 206.0 − − − 36.8 37.7 − − 1.27 GMRTJ084118+451630 08 41 18.1 45 16 30.8 612.6 190.6 200.0 109.2 48.0 − 54.7 51.7 143.1 − 0.94 GMRTJ083516+460009 08 35 16.5 46 0 9.6 604.7 204.8 231.0 − − − 70.5 68.1 − − 0.99 GMRTJ083348+454311 08 33 48.0 45 43 11.2 601.9 243.8 245.0 122.3 − − 77.1 76.2 − − 0.96 GMRTJ083527+440950 08 35 27.4 44 9 50.3 596.5 180.8 195.0 100.4 − − 42.6 42.1 − − 1.21 GMRTJ084734+460928 08 47 34.3 46 9 28.8 590.6 387.8 333.0 − − − 289.6 272.0 − − 0.33 GMRTJ083431+451628 08 34 31.4 45 16 28.4 553.7 172.2 192.0 107.2 41.4 − 52.3 52.4 − − 1.09 GMRTJ084506+425715 08 45 6.2 42 57 15.4 544.0 44.2 328.0 − − − 224.0 218.4 − − 0.39 GMRTJ083753+442123 08 37 53.7 44 21 23.7 533.1 437.1 461.0 362.0 238.2 − 212.7 210.4 − − 0.40 GMRTJ083457+440336 08 34 57.7 44 3 36.4 527.8 251.3 255.0 185.0 − − 148.0 147.9 − − 0.58 GMRTJ083349+432020 08 33 49.3 43 20 20.5 503.1 163.8 114.0 − − − 25.1 24.8 − − 1.37 GMRTJ084423+464548 08 44 23.4 46 45 48.5 490.7 256.5 275.0 − − − 98.7 101.1 − − 0.71 GMRTJ084040+425807 08 40 40.6 42 58 7.6 482.1 205.0 215.0 − − − 85.6 85.9 − − 0.78 GMRTJ083308+454704 08 33 8.7 45 47 4.8 473.4 157.3 218.0 − − − 56.7 59.5 − − 0.95 GMRTJ083911+450409 08 39 11.3 45 4 9.2 468.6 153.4 156.0 82.2 40.4 − 35.9 31.9 − − 1.15 GMRTJ083503+433520 08 35 3.9 43 35 20.9 465.4 171.1 165.0 − − − 41.2 36.0 − − 1.13 GMRTJ084536+431435 08 45 36.5 43 14 35.3 440.4 156.0 161.0 99.6 − − 53.7 52.1 − − 0.97 GMRTJ083522+453305 08 35 22.0 45 33 5.3 416.8 164.9 150.0 85.8 − − 41.1 39.0 − − 1.06 GMRTJ084244+455127 08 42 44.1 45 51 27.8 398.7 147.0 139.0 78.5 − − 43.9 39.7 − − 1.03 GMRTJ083715+461115 08 37 15.7 46 11 15.1 392.8 146.5 155.0 − − − 43.3 43.8 − − 0.99 GMRTJ083703+460423 08 37 3.8 46 4 23.3 392.4 159.4 163.0 − − − 46.0 46.8 − − 0.96 GMRTJ083757+443443 08 37 57.1 44 34 43.4 378.6 142.8 148.0 83.8 35.2 − 36.2 33.0 − − 1.06 GMRTJ083257+455927 08 32 57.9 45 59 27.8 375.1 − 148.0 − − − 34.7 31.3 − − 1.09 GMRTJ084644+432903 08 46 44.8 43 29 3.2 371.8 128.7 157.0 79.9 − − 35.4 34.9 − − 1.06 GMRTJ083702+434202 08 37 2.6 43 42 2.3 358.2 121.0 134.0 − − − 28.8 26.4 − − 1.16 GMRTJ084141+465233 08 41 41.2 46 52 33.5 354.2 − 182.0 − − − 73.3 74.5 − − 0.70 GMRTJ083442+462121 08 34 42.6 46 21 21.9 345.7 − 177.0 − − − 64.1 65.8 − − 0.75 GMRTJ084519+434953 08 45 19.9 43 49 53.2 342.7 126.6 122.0 84.8 − − 40.2 38.9 19.5 − 1.04 GMRTJ083825+432522 08 38 25.6 43 25 22.3 315.1 100.6 98.0 − − − 26.0 6.7 − − 1.37 GMRTJ084457+464855 08 44 57.7 46 48 55.0 297.9 − 126.0 − − − 43.1 43.6 − − 0.86 GMRTJ083927+455854 08 39 27.2 45 58 54.7 284.1 85.4 100.0 51.4 − − 26.1 22.1 − − 1.12 GMRTJ083905+455551 08 39 5.9 45 55 51.1 276.8 127.8 103.0 43.6 − − 34.4 25.1 − − 1.04 GMRTJ085354+444701 08 53 54.5 44 47 1.8 275.0 100.8 125.0 78.9 − − 36.5 36.9 − − 0.89 GMRTJ084456+425833 08 44 56.8 42 58 33.9 269.2 21.2 − − − − 16.4 16.4 − − 1.29 GMRTJ084540+425932 08 45 40.1 42 59 32.8 267.5 94.9 93.0 − − − 24.6 25.9 − − 1.06 GMRTJ083444+460804 08 34 44.2 46 8 4.7 258.3 165.3 217.0 − − − 99.6 101.9 − − 0.42 GMRTJ084252+443408 08 42 52.8 44 34 8.5 252.2 71.6 79.0 44.8 24.8 − 23.3 22.6 45.8 − 0.94 GMRTJ083507+453628 08 35 7.7 45 36 28.7 251.2 62.0 94.0 36.0 − − 21.4 11.6 − − 1.25 GMRTJ083823+461714 08 38 23.7 46 17 14.9 250.9 112.0 122.0 − − − 39.9 35.3 − − 0.85 GMRTJ084307+453741 08 43 7.1 45 37 41.3 250.8 196.0 210.0 234.4 − − 268.7 264.6 − − -0.06 GMRTJ084552+424638 08 45 52.0 42 46 38.2 249.0 103.3 90.0 − − − 30.8 30.2 − − 0.94 GMRTJ084214+440912 08 42 14.2 44 9 12.1 244.7 − 93.0 49.0 − − 22.5 23.2 28.4 − 1.02 GMRTJ083955+461008 08 39 55.9 46 10 8.6 241.8 92.9 105.0 − − − 28.5 29.6 − − 0.95 a Windhorst et al. 1984 b Oort et al. 1987

© 2009 RAS, MNRAS 000, 1–??

14 C. H. Ishwara-Chandra et al.

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ084300+453423 08 43 0.8 45 34 23.8 234.3 83.2 78.0 42.0 − − 21.5 15.6 − − 1.15 GMRTJ084627+453128 08 46 27.2 45 31 28.7 233.9 89.4 102.0 46.1 − − 17.1 19.0 − − 1.15 GMRTJ083957+432301 08 39 57.8 43 23 1.2 225.8 57.9 64.0 − − − 21.4 18.2 − − 1.10 GMRTJ084522+434350 08 45 22.6 43 43 50.1 219.9 81.6 76.0 47.3 − − 24.1 24.6 − − 0.99 GMRTJ084654+455935 08 46 54.4 45 59 35.7 219.7 79.7 83.0 − − − 17.5 19.9 − − 1.11 GMRTJ085020+440006 08 50 20.0 44 0 6.7 209.3 71.1 69.0 39.5 16.5 − 19.0 18.2 − − 1.09 GMRTJ083543+453534 08 35 43.0 45 35 34.9 209.0 49.9 47.0 34.3 − − 22.6 21.1 − − 1.03 GMRTJ083727+464001 08 37 27.3 46 40 1.3 207.1 61.2 78.0 − − − 24.3 24.5 − − 0.96 GMRTJ083656+443219 08 36 56.9 44 32 19.6 204.8 92.4 91.0 57.8 34.6 − 31.6 30.8 − − 0.81 GMRTJ084053+441647 08 40 53.2 44 16 47.1 204.7 76.4 78.0 49.5 19.0 − 22.5 18.4 22.3 − 1.00 GMRTJ083656+434534 08 36 56.9 43 45 34.2 200.6 81.7 101.0 95.7 − − 32.6 30.9 − − 0.77 GMRTJ084251+464505 08 42 51.5 46 45 5.1 198.5 75.3 72.0 − − − 19.3 19.6 − − 1.04 GMRTJ084046+460719 08 40 46.4 46 7 19.9 197.1 90.4 78.0 − − − 24.7 17.2 − − 1.01 GMRTJ084747+451016 08 47 47.7 45 10 16.8 196.9 68.9 64.0 42.7 − 16.9 20.3 21.0 11.9 − 1.06 GMRTJ083952+430146 08 39 52.2 43 1 46.4 194.0 151.0 144.0 − − − 135.4 126.9 − − 0.16 GMRTJ083117+445527 08 31 17.7 44 55 27.7 193.4 − 60.0 − − − 21.4 20.1 − − 1.00 GMRTJ084332+461703 08 43 32.5 46 17 3.4 192.8 73.9 77.0 − − − 20.7 18.2 − − 1.03 GMRTJ084947+461014 08 49 47.5 46 10 14.0 191.9 73.4 91.0 − − − 26.1 26.5 − − 0.89 GMRTJ084306+445552 08 43 6.8 44 55 52.2 191.7 70.7 69.0 36.8 15.0 − 16.4 16.4 9.1 − 1.16 GMRTJ084559+425706 08 45 59.7 42 57 6.0 191.1 64.4 75.0 − − − 19.7 16.3 − − 1.06 GMRTJ085056+442410 08 50 56.9 44 24 10.4 190.6 103.9 98.0 66.7 34.5 51.0 35.6 33.4 − − 0.71 GMRTJ084928+442828 08 49 28.2 44 28 28.6 187.8 71.2 66.0 35.9 17.2 17.2 15.9 9.8 − − 1.12 GMRTJ083905+454415 08 39 5.6 45 44 15.3 186.4 66.4 82.0 44.5 − − 23.3 19.5 − − 0.97 GMRTJ085053+443748 08 50 53.3 44 37 48.3 186.3 86.6 81.0 62.6 33.8 33.0 35.1 33.2 − − 0.73 GMRTJ085316+444520 08 53 16.9 44 45 20.2 179.4 69.0 69.0 44.4 − − 21.9 20.6 − − 0.95 GMRTJ084456+431113 08 44 56.5 43 11 13.8 176.4 75.2 83.0 41.8 − − 29.5 35.3 − − 0.78 GMRTJ084842+455357 08 48 42.4 45 53 57.5 175.5 62.0 75.0 − − − 17.2 17.2 − − 1.04 GMRTJ084322+461433 08 43 22.0 46 14 33.0 169.2 64.1 61.0 − − − 17.4 12.9 − − 1.08 GMRTJ083822+465037 08 38 22.4 46 50 37.2 168.1 − 80.0 − − − 22.7 25.5 − − 0.87 GMRTJ083111+435846 08 31 11.1 43 58 46.5 164.3 − 34.0 − − − 6.6 9.7 − − 1.36 GMRTJ084004+442048 08 40 4.2 44 20 48.3 162.4 65.0 46.0 42.3 23.0 − 17.7 18.2 − − 0.91 GMRTJ085330+452256 08 53 30.3 45 22 56.5 162.1 50.5 40.0 − − − 13.4 12.8 − − 1.13 GMRTJ084357+452713 08 43 57.9 45 27 13.8 161.8 62.2 66.0 35.5 − − 18.9 20.1 − − 0.96 GMRTJ084316+450801 08 43 16.4 45 8 1.0 160.3 61.4 62.0 42.0 20.5 − 27.7 26.1 − − 0.81 GMRTJ084421+425145 08 44 21.9 42 51 45.5 158.4 48.9 41.0 − − − 15.0 12.0 − − 1.11 GMRTJ084220+424651 08 42 20.4 42 46 51.7 158.4 − 61.0 − − − 13.8 15.0 − − 1.07 GMRTJ085135+451544 08 51 35.6 45 15 44.3 157.6 58.1 65.0 35.1 − 17.8 24.5 22.9 − − 0.88 GMRTJ083621+435252 08 36 21.6 43 52 52.5 156.4 71.1 70.0 52.0 − − 30.6 31.4 − − 0.71 GMRTJ083937+444630 08 39 37.7 44 46 30.8 156.2 41.8 31.0 18.6 − − − − − − 1.65 GMRTJ084816+432922 08 48 16.1 43 29 22.9 155.8 84.4 79.0 32.2 − − 20.2 16.8 − − 0.98 GMRTJ084012+440710 08 40 12.4 44 7 10.3 154.6 58.3 55.0 36.8 − − 26.6 24.4 − − 0.81 GMRTJ085018+432248 08 50 18.3 43 22 48.4 153.7 44.2 41.0 − − − 10.9 10.9 − − 1.19 GMRTJ084636+444141 08 46 36.4 44 41 41.5 153.0 50.5 38.0 35.1 17.6 9.1 18.8 17.3 18.2 − 0.94 GMRTJ084424+462527 08 44 24.7 46 25 27.9 150.7 49.9 49.0 − − − 13.2 10.7 − − 1.14 GMRTJ083643+425624 08 36 43.6 42 56 24.4 150.7 55.3 51.0 − − − 14.7 15.5 − − 1.03 GMRTJ083655+435321 08 36 55.8 43 53 21.7 150.3 63.0 56.0 41.8 − − 21.3 20.6 − − 0.87 GMRTJ084616+463234 08 46 16.2 46 32 34.3 150.3 57.0 63.0 − − − 21.0 12.0 − − 0.99 GMRTJ083127+453214 08 31 27.2 45 32 14.2 148.3 − 43.0 − − − 11.1 11.6 − − 1.15 GMRTJ084211+445404 08 42 11.8 44 54 4.9 147.4 50.6 34.0 24.2 9.7 − 8.8 9.7 − − 1.21 GMRTJ084119+424624 08 41 19.3 42 46 24.0 147.4 75.3 48.0 − − − 14.8 14.2 − − 1.04 GMRTJ083418+461556 08 34 18.2 46 15 56.7 147.3 63.9 52.0 − − − 25.0 22.7 − − 0.81 GMRTJ083050+452850 08 30 50.1 45 28 50.7 144.3 − 54.0 − − − 20.4 21.8 − − 0.86 GMRTJ084755+445359 08 47 55.7 44 53 59.4 143.0 45.4 48.0 36.6 8.5 14.2 15.5 9.9 − − 1.07 GMRTJ084528+440732 08 45 28.7 44 7 32.5 141.8 38.3 36.0 19.1 4.5 − 5.4 5.2 − − 1.48 GMRTJ084015+453724 08 40 15.3 45 37 24.2 141.5 40.4 52.0 23.8 − − 8.4 9.9 − − 1.23 GMRTJ084017+450536 08 40 17.7 45 5 36.7 138.9 70.3 80.0 45.6 24.7 − 23.3 24.1 − − 0.79 GMRTJ084539+462809 08 45 39.5 46 28 9.5 137.0 59.7 79.0 − − − 30.8 33.6 − − 0.64 GMRTJ084209+425904 08 42 9.7 42 59 4.4 135.7 50.7 43.0 − − − 18.9 18.9 − − 0.87 GMRTJ084743+434126 08 47 43.3 43 41 26.3 135.4 45.3 51.0 33.4 − − 16.4 17.2 − − 0.92 GMRTJ083546+464203 08 35 46.9 46 42 3.8 134.8 − 52.0 − − − 12.6 13.8 − − 1.04 GMRTJ084218+453057 08 42 18.5 45 30 57.0 134.3 57.8 73.0 30.0 − − 17.2 15.1 − − 0.97 GMRTJ084841+454216 08 48 41.3 45 42 16.8 134.2 44.0 37.0 31.5 − − 16.9 16.1 − − 0.92 GMRTJ083326+462452 08 33 26.3 46 24 52.6 132.8 − 34.0 − − − 21.3 18.1 − − 0.84 GMRTJ084036+443132 08 40 36.6 44 31 32.3 132.7 47.1 32.0 30.2 11.2 − 12.3 13.7 − − 1.02 GMRTJ084824+432240 08 48 24.6 43 22 40.2 132.3 35.4 33.0 22.9 − − 8.0 8.7 − − 1.23 GMRTJ083540+462934 08 35 40.2 46 29 34.4 130.6 − 58.0 − − − 24.3 25.8 − − 0.73

© 2009 RAS, MNRAS 000, 1–??

Deep GMRT 150 MHz observations of LBDS field 15

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ084515+431304 08 45 15.1 43 13 4.7 129.1 38.5 41.0 − − − 12.9 15.1 − − 0.99 GMRTJ083348+441303 08 33 48.5 44 13 3.5 128.4 47.6 46.0 − − − 16.1 15.9 − − 0.93 GMRTJ083638+440516 08 36 38.2 44 5 16.0 126.9 65.8 71.0 48.0 − − 28.8 25.8 − − 0.68 GMRTJ084745+433813 08 47 45.4 43 38 13.8 126.6 52.1 56.0 42.0 − − 23.7 22.4 − − 0.74 GMRTJ084215+452536 08 42 15.6 45 25 36.1 126.3 80.6 78.0 61.2 75.6 − 74.0 71.6 304.0 − -0.09 GMRTJ084706+434616 08 47 6.9 43 46 16.3 126.2 68.2 69.0 47.3 − − 28.6 27.6 − − 0.67 GMRTJ084315+435631 08 43 15.8 43 56 31.0 124.5 49.2 51.0 32.0 − − 13.4 12.6 − − 1.00 GMRTJ083817+452210 08 38 17.7 45 22 10.5 124.4 42.1 43.0 30.4 12.3 − 15.1 12.5 − − 0.97 GMRTJ084728+430552 08 47 28.2 43 5 52.0 124.0 62.6 − − − − 10.6 11.2 − − 1.09 GMRTJ085120+445634 08 51 20.8 44 56 34.8 123.3 45.4 47.0 31.0 − 13.9 21.8 12.9 − − 0.89 GMRTJ084010+465403 08 40 10.3 46 54 3.3 121.9 − 54.0 − − − 13.4 14.5 − − 0.97 GMRTJ083238+450558 08 32 38.9 45 5 58.5 121.2 48.6 31.0 − − − 14.4 14.1 − − 0.95 GMRTJ084311+433104 08 43 11.0 43 31 4.7 118.3 37.2 22.0 17.3 − − 11.2 11.4 − − 1.06 GMRTJ084612+435932 08 46 12.5 43 59 32.2 115.8 54.8 45.0 41.9 − − 22.2 21.5 − − 0.72 GMRTJ084823+462916 08 48 23.0 46 29 16.8 114.1 70.6 52.0 − − − 12.7 12.7 − − 0.99 GMRTJ084817+433038 08 48 17.3 43 30 38.3 112.4 − − 11.0 − − 4.8 3.8 − − 1.49 GMRTJ083806+435854 08 38 6.6 43 58 54.8 112.3 52.4 32.0 35.1 − − 16.2 14.9 − − 0.86 GMRTJ085053+460440 08 50 53.0 46 4 40.0 110.6 26.6 41.0 − − − 6.8 6.1 − − 1.27 GMRTJ085028+445522 08 50 28.4 44 55 22.4 108.6 37.8 39.0 25.6 7.8 10.1 10.2 9.0 − − 1.07 GMRTJ083833+441018 08 38 33.1 44 10 18.4 108.5 45.9 35.0 28.0 − − 14.5 15.3 − − 0.88 GMRTJ083727+455225 08 37 27.6 45 52 25.5 105.8 45.3 45.0 46.6 − − 28.3 27.0 − − 0.56 GMRTJ083454+452946 08 34 54.7 45 29 46.8 104.7 45.5 50.0 36.9 − − 20.8 20.6 − − 0.71 GMRTJ084000+463302 08 40 0.5 46 33 2.9 102.5 46.5 41.0 − − − 11.5 10.5 − − 1.00 GMRTJ083846+435501 08 38 46.9 43 55 1.4 101.8 60.8 42.0 52.4 − − 23.9 17.6 − − 0.67 GMRTJ084817+441318 08 48 17.5 44 13 18.3 101.4 49.7 40.0 35.3 19.3 − 19.9 19.9 − − 0.70 GMRTJ084433+435015 08 44 33.8 43 50 15.9 101.0 40.5 40.0 19.6 − − 12.3 14.6 − − 0.92 GMRTJ083832+441851 08 38 32.6 44 18 51.9 100.3 78.9 − 36.1 − − 23.6 22.6 − − 0.69 GMRTJ084223+425532 08 42 23.9 42 55 32.1 100.0 27.3 17.0 − − − 6.5 7.4 − − 1.19 GMRTJ083044+454239 08 30 44.5 45 42 39.8 99.5 − − − − − − − − − − GMRTJ084627+440523 08 46 27.6 44 5 23.2 97.8 77.7 76.0 72.6 46.3 − 45.3 44.8 − − 0.34 GMRTJ085150+455240 08 51 50.1 45 52 40.6 97.0 27.1 44.0 − − − 12.7 11.7 − − 0.92 GMRTJ083527+440004 08 35 27.4 44 0 4.0 94.2 18.9 24.0 28.6 − − 10.3 4.3 − − 1.08 GMRTJ084423+431031 08 44 23.5 43 10 31.3 93.2 38.2 27.0 − − − 15.8 17.3 − − 0.75 GMRTJ085230+454104 08 52 30.5 45 41 4.7 92.9 32.0 19.0 − − − 9.3 10.6 − − 0.99 GMRTJ085308+441109 08 53 8.4 44 11 9.0 92.6 − − 20.0 − − 6.8 9.7 − − 1.09 GMRTJ084001+444450 08 40 1.7 44 44 50.5 92.3 41.1 45.0 35.9 24.5 − 23.4 25.1 − − 0.56 GMRTJ083212+451934 08 32 12.3 45 19 34.2 90.8 − 24.0 − − − 10.0 6.8 − − 1.06 GMRTJ084734+462724 08 47 34.3 46 27 24.5 90.6 52.9 57.0 − − − 21.1 20.2 − − 0.66 GMRTJ084804+425728 08 48 4.3 42 57 28.1 90.4 49.6 36.0 − − − 8.4 5.3 − − 1.16 GMRTJ084052+453754 08 40 52.9 45 37 54.1 90.0 42.8 46.0 34.5 − − 22.7 20.1 − − 0.63 GMRTJ083641+430324 08 36 41.6 43 3 24.1 89.6 39.5 35.0 − − − 23.5 21.4 − − 0.59 GMRTJ083919+455119 08 39 19.1 45 51 19.5 88.3 40.6 40.0 26.2 − − 15.7 16.3 − − 0.76 GMRTJ083029+454246 08 30 29.3 45 42 46.7 88.1 − − − − − − − − − − GMRTJ084332+423631 08 43 32.1 42 36 31.9 86.3 27.3 34.0 − − − 14.7 16.6 − − 0.74 GMRTJ084023+432130 08 40 23.0 43 21 30.5 86.3 73.4 33.0 − − − 10.7 10.6 − − 0.95 GMRTJ084157+434105 08 41 57.5 43 41 5.6 86.2 29.1 25.0 − − − 9.6 7.8 − − 1.02 GMRTJ083758+434821 08 37 58.3 43 48 21.0 85.2 32.1 30.0 22.2 − − 5.7 7.3 − − 1.12 GMRTJ085022+450059 08 50 22.4 45 0 59.9 85.2 45.9 42.0 33.8 − 20.3 23.1 23.2 − − 0.58 GMRTJ084826+444025 08 48 26.3 44 40 25.7 85.1 30.1 23.0 22.1 12.1 14.6 12.2 11.9 − − 0.78 GMRTJ083640+432426 08 36 40.9 43 24 26.9 84.8 52.7 39.0 − − − 17.8 13.2 − − 0.76 GMRTJ083658+442600 08 36 58.9 44 26 0.3 84.7 38.4 31.0 23.2 − − 6.6 10.2 − − 1.02 GMRTJ083044+454324 08 30 44.4 45 43 24.4 84.5 − − − − − − − − − − GMRTJ084437+442558 08 44 37.3 44 25 58.6 84.0 17.6 − 8.9 2.3 − − 2.2 5.1 0.26 1.53 GMRTJ083854+443847 08 38 54.9 44 38 47.6 83.8 51.9 51.0 40.4 26.3 − 20.8 24.8 − − 0.55 GMRTJ083756+435431 08 37 56.8 43 54 31.1 81.2 25.4 17.0 16.6 − − 8.8 8.7 − − 0.98 GMRTJ083237+443334 08 32 37.5 44 33 34.3 80.3 34.1 33.0 − − − 14.7 10.3 − − 0.82 GMRTJ084242+453312 08 42 42.3 45 33 12.8 80.1 32.1 33.0 14.6 − − 8.7 9.8 − − 0.99 GMRTJ083754+442640 08 37 54.0 44 26 40.1 79.5 43.3 38.0 27.1 − − 11.9 10.0 − − 0.88 GMRTJ084115+454711 08 41 15.6 45 47 11.6 79.4 39.6 37.0 19.3 − − 14.7 13.0 − − 0.80 GMRTJ084116+431053 08 41 16.1 43 10 53.8 79.1 33.9 31.0 − − − 12.6 12.5 − − 0.81 GMRTJ083413+452800 08 34 13.2 45 28 0.5 78.8 29.4 39.0 29.6 − − 14.1 11.8 − − 0.78 GMRTJ084519+454907 08 45 19.6 45 49 7.9 78.5 26.9 29.0 − − − 4.6 4.7 − − 1.27 GMRTJ083246+450716 08 32 46.0 45 7 16.2 75.5 − − − − − 4.5 4.3 − − 1.27 GMRTJ083818+425032 08 38 18.6 42 50 32.1 74.8 − 31.0 − − − 12.2 12.4 − − 0.80 GMRTJ084758+433504 08 47 58.3 43 35 4.7 72.4 32.9 20.0 20.2 − − 12.2 16.4 − − 0.71 GMRTJ084801+454609 08 48 1.3 45 46 9.7 71.9 28.5 26.0 − − − 6.8 11.7 − − 0.92

© 2009 RAS, MNRAS 000, 1–??

16 C. H. Ishwara-Chandra et al.

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ084541+444011 08 45 41.3 44 40 11.0 70.6 32.9 34.0 21.5 11.7 − 11.1 12.6 11.8 − 0.78 GMRTJ085001+462600 08 50 1.3 46 26 0.7 70.1 55.1 54.0 − − − 16.0 21.3 − − 0.61 GMRTJ084943+435806 08 49 43.8 43 58 6.5 69.6 32.6 14.0 23.8 12.4 − 13.4 12.6 − − 0.69 GMRTJ084757+441210 08 47 57.0 44 12 10.8 69.0 − 22.0 19.5 10.3 − 10.6 10.7 − − 0.81 GMRTJ083637+431808 08 36 37.2 43 18 8.2 68.6 − 20.0 − − − 10.2 11.1 − − 0.81 GMRTJ084336+440153 08 43 36.6 44 1 53.7 68.3 25.7 26.0 16.7 − − 8.9 8.6 − − 0.91 GMRTJ083133+451116 08 31 33.7 45 11 16.4 67.3 − − − − − 10.2 9.6 − − 0.86 GMRTJ084258+434157 08 42 58.9 43 41 57.5 66.9 26.4 18.0 19.9 − − 11.2 11.8 − − 0.75 GMRTJ084013+432319 08 40 13.5 43 23 19.8 66.8 − − − − − 5.0 4.1 − − 1.20 GMRTJ083840+441753 08 38 40.8 44 17 53.0 66.6 − − 55.9 − − 23.7 26.3 − − 0.41 GMRTJ085158+453448 08 51 58.0 45 34 48.8 66.5 18.9 27.0 − − − 6.0 5.7 − − 1.08 GMRTJ084145+461601 08 41 45.5 46 16 1.4 66.2 43.4 34.0 − − − 12.1 9.6 − − 0.82 GMRTJ083841+444820 08 38 41.6 44 48 20.9 66.1 74.3 56.0 33.8 15.8 − 16.0 18.9 − − 0.69 GMRTJ084022+462053 08 40 22.5 46 20 53.3 65.9 36.4 30.0 − − − 13.3 13.8 − − 0.70 GMRTJ083615+445713 08 36 15.5 44 57 13.2 65.3 48.0 60.0 44.9 32.8 − 36.4 25.9 − − 0.33 GMRTJ083656+463302 08 36 56.8 46 33 2.5 65.0 − 19.0 − − − 15.3 15.3 − − 0.61 GMRTJ083645+452221 08 36 45.4 45 22 21.6 64.6 36.7 19.0 24.9 16.2 − 14.1 16.1 − − 0.59 GMRTJ083629+430053 08 36 29.0 43 0 53.0 64.2 − − − − − 4.4 4.7 − − 1.19 GMRTJ084830+460300 08 48 30.0 46 3 0.6 63.7 31.0 28.0 − − − 9.5 9.9 − − 0.83 GMRTJ084730+440822 08 47 30.6 44 8 22.5 63.6 25.6 17.0 12.1 4.6 − 6.1 4.5 − − 1.11 GMRTJ084412+452401 08 44 12.5 45 24 1.5 63.6 42.5 29.0 33.0 − − 30.9 29.4 34.3 − 0.26 GMRTJ084328+452325 08 43 28.0 45 23 25.5 62.9 28.0 29.0 12.2 − − 5.8 5.6 − − 1.09 GMRTJ084402+462616 08 44 2.0 46 26 16.6 62.6 26.3 36.0 − − − 6.3 − − − 1.01 GMRTJ083210+452335 08 32 10.4 45 23 35.6 62.5 27.7 34.0 − − − 40.4 42.9 − − 0.11 GMRTJ084022+431928 08 40 22.0 43 19 28.4 62.1 − − − − − 5.4 4.1 − − 1.16 GMRTJ084012+432511 08 40 12.4 43 25 11.9 61.9 49.2 − − − − 6.0 5.9 − − 1.07 GMRTJ085039+452157 08 50 39.1 45 21 57.1 61.4 20.0 16.0 17.3 − 6.1 6.4 6.3 − − 0.96 GMRTJ083859+424414 08 38 59.3 42 44 14.5 60.5 − − − − − 2.5 3.5 − − 1.35 GMRTJ084342+451224 08 43 42.6 45 12 24.8 58.8 30.7 29.0 20.9 10.4 − 11.3 11.5 − − 0.73 GMRTJ084217+433627 08 42 17.3 43 36 27.1 58.5 20.2 18.0 − − − 6.9 6.1 − − 0.97 GMRTJ083532+452511 08 35 32.3 45 25 11.9 57.5 35.1 20.0 23.2 − − 11.8 11.7 − − 0.68 GMRTJ084941+461902 08 49 41.7 46 19 2.3 57.3 − − − − − − − − − − GMRTJ083848+452629 08 38 48.2 45 26 29.0 57.3 23.7 26.0 17.5 − − 6.1 8.7 − − 0.90 GMRTJ083746+433353 08 37 46.2 43 33 53.9 56.5 19.8 − − − − 7.8 10.6 − − 0.80 GMRTJ084216+434841 08 42 16.1 43 48 41.2 56.4 24.4 19.0 − − − 9.3 4.7 − − 0.94 GMRTJ083850+452130 08 38 50.2 45 21 30.7 56.0 16.8 21.0 21.1 9.9 − 11.0 12.6 − − 0.65 GMRTJ083132+450742 08 31 32.4 45 7 42.9 55.9 31.0 15.0 − − − 6.4 5.7 − − 0.99 GMRTJ084636+462225 08 46 36.4 46 22 25.2 55.9 − − − − − − − − − − GMRTJ083531+445523 08 35 31.8 44 55 23.8 55.8 29.3 39.0 24.0 8.5 − 11.6 8.8 − − 0.79 GMRTJ084649+462226 08 46 49.3 46 22 26.7 55.8 − − − − − − − − − − GMRTJ084107+430625 08 41 7.9 43 6 25.4 55.5 31.6 33.0 − − − 22.0 27.5 − − 0.33 GMRTJ083649+441608 08 36 49.8 44 16 8.4 54.8 − 19.0 24.1 − − 14.3 14.2 − − 0.56 GMRTJ084101+454515 08 41 1.3 45 45 15.5 54.3 20.1 − 13.6 − − 7.5 7.9 − − 0.87 GMRTJ084213+465624 08 42 13.3 46 56 24.5 54.2 − 25.0 − − − 12.5 11.5 − − 0.66 GMRTJ084659+432650 08 46 59.7 43 26 50.4 53.8 21.1 22.0 15.3 − − 6.2 7.8 − − 0.89 GMRTJ083833+461651 08 38 33.8 46 16 51.6 53.3 − − − − − − 1.7 − − 1.53 GMRTJ084525+455739 08 45 25.1 45 57 39.8 53.0 29.7 23.0 − − − 11.9 8.4 − − 0.73 GMRTJ083959+424012 08 39 59.7 42 40 12.5 52.8 − 28.0 − − − 10.9 7.2 − − 0.80 GMRTJ083206+455546 08 32 6.8 45 55 46.6 51.7 − 31.0 − − − 14.2 8.9 − − 0.68 GMRTJ084415+441121 08 44 15.5 44 11 21.1 51.2 26.1 24.0 26.2 21.4 − 20.5 20.3 22.5 − 0.32 GMRTJ083446+434337 08 34 46.9 43 43 37.4 50.6 − 12.0 − − − 7.4 6.5 − − 0.86 GMRTJ084244+450535 08 42 44.6 45 5 35.9 50.5 16.7 − 14.4 8.1 − 8.1 8.5 − − 0.78 GMRTJ084748+441228 08 47 48.2 44 12 28.8 50.3 55.0 18.0 10.5 5.1 − 5.8 5.0 − − 1.08 GMRTJ083745+460026 08 37 45.9 46 0 26.7 50.2 19.0 22.0 − − − 6.1 5.6 − − 0.95 GMRTJ084415+430136 08 44 15.8 43 1 36.3 49.2 15.2 − − − − 4.0 1.5 − − 1.31 GMRTJ083114+441956 08 31 14.0 44 19 56.9 48.8 − − − − − 8.0 6.8 − − 0.85 GMRTJ084644+445733 08 46 44.6 44 57 33.0 48.6 21.6 15.0 11.9 5.8 6.0 6.5 6.9 5.2 − 0.89 GMRTJ083311+431954 08 33 11.2 43 19 54.8 48.2 − 20.0 − − − 8.4 7.9 − − 0.78 GMRTJ083835+454354 08 38 35.8 45 43 54.3 48.2 28.6 40.0 34.9 − − 16.8 17.6 − − 0.44 GMRTJ084412+451032 08 44 12.1 45 10 32.7 48.2 26.6 21.0 12.4 − − 6.6 7.0 − − 0.89 GMRTJ083639+432614 08 36 39.7 43 26 14.7 47.8 − − − − − 6.8 7.3 − − 0.86 GMRTJ084530+461035 08 45 30.6 46 10 35.5 47.1 28.0 19.0 − − − 7.8 7.9 − − 0.80 GMRTJ083600+440952 08 36 0.7 44 9 52.4 46.3 − − 21.5 − − 13.7 10.4 − − 0.60 GMRTJ083421+431220 08 34 21.4 43 12 20.1 46.1 − 18.0 − − − 8.1 9.1 − − 0.73 GMRTJ084629+462217 08 46 29.5 46 22 17.2 45.8 − − − − − − − − − − GMRTJ084727+430436 08 47 27.3 43 4 36.6 45.6 − − − − − 5.6 5.1 − − 0.96

© 2009 RAS, MNRAS 000, 1–??

Deep GMRT 150 MHz observations of LBDS field 17

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ084045+460817 08 40 45.0 46 8 17.2 45.5 − − − − − 3.1 4.8 − − 1.10 GMRTJ083658+460845 08 36 58.7 46 8 45.6 45.0 23.4 20.0 − − − 9.7 5.1 − − 0.81 GMRTJ083018+453459 08 30 18.8 45 34 59.0 44.7 − 30.0 − − − 9.8 10.0 − − 0.68 GMRTJ084643+462149 08 46 43.6 46 21 49.5 44.4 − − − − − − − − − − GMRTJ084837+442936 08 48 37.0 44 29 36.9 44.2 27.3 19.0 17.7 11.0 12.0 12.3 11.5 − − 0.56 GMRTJ084410+424720 08 44 10.6 42 47 20.6 43.5 − 19.0 − − − 8.9 10.8 − − 0.65 GMRTJ084433+445017 08 44 33.9 44 50 17.7 43.3 15.7 − 10.3 4.6 − 3.6 5.2 3.4 1.46 0.99 GMRTJ084400+454228 08 44 0.1 45 42 28.6 43.1 16.4 − − − − 6.6 7.0 − − 0.81 GMRTJ083643+462555 08 36 43.1 46 25 55.2 43.0 − 14.0 − − − 10.2 9.4 − − 0.63 GMRTJ084918+430514 08 49 18.5 43 5 14.0 42.8 21.2 24.0 − − − 11.2 11.3 − − 0.58 GMRTJ083501+453542 08 35 1.8 45 35 42.4 42.8 − − − − − 7.6 4.3 − − 0.89 GMRTJ083950+464709 08 39 50.4 46 47 9.0 42.7 − 17.0 − − − 8.2 8.6 − − 0.71 GMRTJ084857+452702 08 48 57.1 45 27 2.8 42.7 29.2 32.0 12.9 − − 7.7 5.1 − − 0.89 GMRTJ085038+445637 08 50 38.1 44 56 37.6 41.9 − − 5.7 − 1.6 − − − − 1.45 GMRTJ084606+445126 08 46 6.8 44 51 26.3 41.8 17.0 15.0 13.7 6.0 6.6 7.5 6.1 6.0 − 0.78 GMRTJ083912+435224 08 39 12.2 43 52 24.3 41.4 15.1 − − − − 8.1 7.4 − − 0.73 GMRTJ083632+450605 08 36 32.9 45 6 5.5 41.3 12.1 − 9.4 4.1 − 3.6 2.3 − − 1.10 GMRTJ084512+433635 08 45 12.1 43 36 35.7 41.0 19.4 14.0 22.2 − − 7.2 9.0 − − 0.65 GMRTJ084845+441445 08 48 45.7 44 14 45.1 41.0 23.4 30.0 17.8 9.5 − 9.7 9.1 − − 0.67 GMRTJ084213+450035 08 42 13.5 45 0 35.7 40.9 16.4 − 12.2 6.0 − 5.7 5.5 − − 0.85 GMRTJ083027+440405 08 30 27.1 44 4 5.2 40.9 − 31.0 − − − 30.0 32.2 − − 0.10 GMRTJ084108+433305 08 41 8.5 43 33 5.2 40.8 14.5 − − − − 5.2 4.3 − − 0.95 GMRTJ085030+450559 08 50 30.2 45 5 59.7 40.6 17.2 19.0 14.5 − 7.6 8.3 7.9 − − 0.69 GMRTJ084719+431802 08 47 19.1 43 18 2.5 40.5 23.8 18.0 − − − 7.6 7.5 − − 0.74 GMRTJ083851+464437 08 38 51.5 46 44 37.3 40.4 − 27.0 − − − 11.0 8.5 − − 0.65 GMRTJ083139+442513 08 31 39.9 44 25 13.5 40.1 − − − − − 7.2 8.6 − − 0.73 GMRTJ084728+454225 08 47 28.9 45 42 25.6 40.0 − − − − − 3.2 4.5 − − 1.05 GMRTJ083549+460413 08 35 49.2 46 4 13.2 39.8 − − − − − 4.4 5.8 − − 0.92 GMRTJ083808+441910 08 38 8.6 44 19 10.2 39.6 9.3 19.0 8.3 − − 2.2 1.9 − − 1.29 GMRTJ083815+464249 08 38 15.3 46 42 49.9 39.6 − 23.0 − − − 7.7 7.6 − − 0.74 GMRTJ084310+454840 08 43 10.1 45 48 40.8 39.6 − − − − − − − − − − GMRTJ083249+434341 08 32 49.4 43 43 41.3 39.5 − − − − − 4.2 4.7 − − 0.98 GMRTJ083816+460632 08 38 16.6 46 6 32.7 39.3 9.9 − − − − 3.9 3.5 − − 1.04 GMRTJ084703+455737 08 47 3.2 45 57 37.5 39.0 23.9 − − − − 11.2 12.0 − − 0.54 GMRTJ084029+450443 08 40 29.4 45 4 43.5 38.7 17.7 19.0 11.3 3.6 − 3.5 2.5 − − 1.12 GMRTJ083640+431624 08 36 40.6 43 16 24.8 38.5 − − − − − 5.2 4.3 − − 0.94 GMRTJ084412+451559 08 44 12.5 45 15 59.8 38.1 12.3 − 6.4 − − 4.3 − − − 1.04 GMRTJ083638+461050 08 36 38.1 46 10 50.6 38.0 − 18.0 − − − 7.0 9.7 − − 0.67 GMRTJ085044+454559 08 50 44.6 45 45 59.0 37.5 − − − − − 3.2 3.0 − − 1.11 GMRTJ084811+460025 08 48 11.8 46 0 25.3 37.5 − − − − − − 1.0 − − 1.61 GMRTJ084152+452134 08 41 52.6 45 21 34.4 37.5 17.2 17.0 13.1 10.7 − 8.1 8.7 − − 0.59 GMRTJ084502+463844 08 45 2.3 46 38 44.6 37.2 − 20.0 − − − 7.9 7.1 − − 0.71 GMRTJ084447+463833 08 44 47.7 46 38 33.8 36.5 − 23.0 − − − 8.9 10.8 − − 0.59 GMRTJ083814+435814 08 38 14.9 43 58 14.9 36.4 − − 10.0 − − 7.0 6.9 − − 0.76 GMRTJ083307+442034 08 33 7.5 44 20 34.4 36.3 − − − − − 5.0 5.1 − − 0.88 GMRTJ084237+424201 08 42 37.3 42 42 1.7 36.1 − − − − − 4.2 5.3 − − 0.91 GMRTJ084018+445948 08 40 18.2 44 59 48.6 35.8 23.2 13.0 13.4 9.8 − 8.7 8.2 − − 0.59 GMRTJ084058+430851 08 40 58.5 43 8 51.5 35.8 − − − − − 3.0 3.2 − − 1.10 GMRTJ084302+435852 08 43 2.2 43 58 52.2 35.8 15.4 − 9.4 − − 3.5 4.5 − − 0.97 GMRTJ083128+455124 08 31 28.4 45 51 24.2 35.7 − − − − − 10.1 10.1 − − 0.57 GMRTJ084715+443752 08 47 15.6 44 37 52.1 34.1 32.1 36.0 12.5 9.2 7.8 9.0 4.2 6.9 − 0.81 GMRTJ084346+461337 08 43 46.4 46 13 37.0 34.0 21.0 − − − − 6.2 4.0 − − 0.86 GMRTJ084335+431024 08 43 35.5 43 10 24.3 33.8 − − − − − − − − − − GMRTJ083648+451242 08 36 48.3 45 12 42.3 33.8 22.0 − 13.8 7.7 − 6.8 7.7 − − 0.69 GMRTJ085058+440531 08 50 58.6 44 5 31.3 33.6 23.5 25.0 12.2 8.9 − 8.0 8.3 − − 0.65 GMRTJ083333+453721 08 33 33.9 45 37 21.5 33.2 − − − − − 6.2 4.9 − − 0.80 GMRTJ083053+443109 08 30 53.4 44 31 9.2 32.8 − − − − − 6.3 6.0 − − 0.75 GMRTJ084416+464418 08 44 16.5 46 44 18.0 32.7 − − − − − 5.7 5.9 − − 0.78 GMRTJ083418+435432 08 34 18.0 43 54 32.6 32.5 − 22.0 − − − 4.4 6.6 − − 0.81 GMRTJ084447+460416 08 44 47.3 46 4 16.8 32.3 11.1 − − − − − − − − − GMRTJ084523+450259 08 45 23.4 45 2 59.2 31.4 17.9 − 8.8 4.7 − 6.2 6.9 − − 0.76 GMRTJ084544+451810 08 45 44.4 45 18 10.2 31.2 9.6 − − − − − − − − − GMRTJ083436+441255 08 34 36.2 44 12 55.4 31.1 − − − − − 8.0 5.5 − − 0.69 GMRTJ083725+452600 08 37 25.7 45 26 0.4 30.9 10.7 − 13.8 − − 6.3 7.1 − − 0.63 GMRTJ083908+450010 08 39 8.9 45 0 10.3 30.7 15.8 − 7.4 3.5 − 7.5 3.0 − − 0.87 GMRTJ084640+435317 08 46 40.1 43 53 17.6 30.3 9.9 − 9.5 − − 3.7 3.6 − − 0.91

© 2009 RAS, MNRAS 000, 1–??

18 C. H. Ishwara-Chandra et al.

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ084647+451848 08 46 47.0 45 18 48.5 30.2 12.6 − 9.5 − 2.6 4.3 3.3 − − 0.96 GMRTJ084524+434917 08 45 24.8 43 49 17.6 29.9 − − 21.5 − − 14.1 14.3 − − 0.33 GMRTJ084201+440552 08 42 1.6 44 5 52.8 29.5 17.7 − 23.5 − − 20.3 18.3 22.5 − 0.12 GMRTJ085311+440913 08 53 11.6 44 9 13.2 29.4 − − − − − − − − − − GMRTJ084420+445802 08 44 20.5 44 58 2.3 29.0 15.6 − 5.9 1.9 − 3.4 3.3 4.7 − 0.99 GMRTJ083554+432943 08 35 54.9 43 29 43.5 29.0 − − − − − 8.3 7.0 − − 0.60 GMRTJ085312+445904 08 53 12.9 44 59 4.2 28.9 − − − − − 3.5 3.3 − − 0.96 GMRTJ084151+462127 08 41 51.8 46 21 27.6 28.8 − − − − − 4.3 3.9 − − 0.87 GMRTJ083643+453340 08 36 43.3 45 33 40.4 28.8 − − − − − − 1.1 − − 1.45 GMRTJ083652+441045 08 36 52.6 44 10 45.3 28.6 29.0 − 6.4 − − 6.8 3.7 − − 0.86 GMRTJ084804+425833 08 48 4.0 42 58 33.8 28.6 − − − − − − − − − − GMRTJ084354+434813 08 43 54.7 43 48 13.7 28.4 15.9 14.0 9.0 − − 4.9 4.2 − − 0.82 GMRTJ083315+432343 08 33 15.7 43 23 43.6 28.3 − 14.0 − − − 3.3 3.8 − − 0.93 GMRTJ084636+430829 08 46 36.6 43 8 29.5 28.2 26.7 − − − − 4.9 − − − 0.76 GMRTJ084157+451034 08 41 57.6 45 10 34.8 28.2 16.8 − 7.8 2.8 − 3.9 4.3 − − 0.93 GMRTJ083852+454614 08 38 52.2 45 46 14.4 28.1 9.5 − 7.0 − − − 3.1 − − 0.98 GMRTJ084505+442543 08 45 5.5 44 25 43.4 28.0 10.1 20.0 7.7 3.0 − 3.1 2.4 2.9 0.75 1.05 GMRTJ083132+443240 08 31 32.1 44 32 40.0 27.9 − − − − − − − − − − GMRTJ084726+432312 08 47 26.6 43 23 12.7 27.8 11.8 − − − − 10.0 10.1 − − 0.42 GMRTJ084225+451436 08 42 25.9 45 14 36.0 27.8 17.3 − 7.8 11.5 − 7.1 3.1 − − 0.64 GMRTJ084527+445524 08 45 27.1 44 55 24.3 27.6 24.0 − 14.1 7.0 − 8.5 6.8 7.4 − 0.63 GMRTJ084704+424807 08 47 4.1 42 48 7.1 27.4 − − − − − 4.1 3.9 − − 0.86 GMRTJ083138+435636 08 31 38.1 43 56 36.6 27.2 − 22.0 − − − 11.1 8.1 − − 0.48 GMRTJ083426+435949 08 34 26.7 43 59 49.4 27.1 − − − − − 4.5 3.3 − − 0.87 GMRTJ083901+443808 08 39 1.6 44 38 8.0 26.8 − − − − − − − − − − GMRTJ083533+443456 08 35 33.3 44 34 56.9 26.8 − 12.0 5.9 − − 3.4 2.5 − − 1.00 GMRTJ083741+464159 08 37 41.8 46 41 59.9 26.6 − − − − − 3.4 − − − 0.92 GMRTJ083405+450501 08 34 5.6 45 5 1.7 26.6 − − 17.8 − − 7.5 6.0 − − 0.59 GMRTJ084019+432706 08 40 19.5 43 27 6.9 26.6 11.9 − − − − 8.6 8.0 − − 0.49 GMRTJ084033+464728 08 40 33.2 46 47 28.7 26.2 − − − − − − − − − − GMRTJ084537+453223 08 45 37.8 45 32 23.5 26.1 11.8 − − − − − − − − − GMRTJ084115+430041 08 41 15.9 43 0 41.3 25.9 − − − − − − 3.4 − − 0.92 GMRTJ083605+441102 08 36 5.3 44 11 2.2 25.9 − − 10.2 − − 5.9 6.5 − − 0.64 GMRTJ084856+440628 08 48 56.4 44 6 28.8 25.8 7.8 − 5.3 2.9 − 3.4 2.6 − − 0.94 GMRTJ084924+454947 08 49 24.4 45 49 47.0 25.7 6.2 − − − − 9.0 6.6 − − 0.47 GMRTJ083654+441747 08 36 54.8 44 17 47.5 25.1 40.9 − 9.5 − − 4.4 4.7 − − 0.88 GMRTJ085307+441147 08 53 7.7 44 11 47.4 25.0 − − − − − − − − − − GMRTJ084522+460200 08 45 22.7 46 2 0.4 24.9 − − − − − 3.2 4.0 − − 0.86 GMRTJ083943+424557 08 39 43.5 42 45 57.9 24.8 − − − − − 5.4 2.8 − − 0.82 GMRTJ085324+450239 08 53 24.7 45 2 39.6 24.7 − − − − − − − − − − GMRTJ084950+452812 08 49 50.6 45 28 12.5 24.5 16.5 − 16.2 − − 4.0 4.3 − − 0.75 GMRTJ085234+445326 08 52 34.6 44 53 26.0 24.5 − − 13.3 − 7.0 6.5 6.6 − − 0.58 GMRTJ083401+441557 08 34 1.9 44 15 57.7 24.4 17.8 18.0 − − − 11.0 9.2 − − 0.40 GMRTJ084005+424657 08 40 5.8 42 46 57.9 24.2 − − − − − 2.5 1.0 − − 1.20 GMRTJ085040+444944 08 50 40.0 44 49 44.1 24.1 9.5 − 9.1 − 4.9 4.6 4.8 − − 0.69 GMRTJ084654+432400 08 46 54.3 43 24 0.1 24.1 17.0 15.0 18.0 − − 21.9 20.8 − − 0.00 GMRTJ085202+435054 08 52 2.6 43 50 54.4 24.1 − − − − − 2.4 1.5 − − 1.13 GMRTJ084533+455835 08 45 33.3 45 58 35.1 23.9 − − − − − − 2.3 − − 1.06 GMRTJ084728+432601 08 47 28.1 43 26 1.8 23.9 12.8 − − − − 3.0 4.0 − − 0.87 GMRTJ085202+454552 08 52 2.1 45 45 52.2 23.8 − − − − − 2.4 2.8 − − 0.99 GMRTJ083818+453946 08 38 18.7 45 39 46.0 23.8 − − 7.7 − − 3.7 2.8 − − 0.88 GMRTJ084453+464416 08 44 53.2 46 44 16.4 23.6 − − − − − 6.4 6.5 − − 0.58 GMRTJ084525+460339 08 45 25.8 46 3 39.6 23.6 − 23.0 − − − 6.9 6.9 − − 0.58 GMRTJ084258+433809 08 42 58.1 43 38 9.4 23.5 10.2 − − − − 3.9 5.0 − − 0.73 GMRTJ083554+460510 08 35 54.0 46 5 10.3 23.4 − − − − − 4.3 4.8 − − 0.73 GMRTJ084718+463926 08 47 18.9 46 39 26.0 23.3 − − − − − 9.9 11.6 − − 0.35 GMRTJ083757+433543 08 37 57.9 43 35 43.8 23.3 13.0 − − − − 2.6 2.8 − − 0.97 GMRTJ084054+443433 08 40 54.7 44 34 33.0 23.0 16.5 − 14.4 8.8 − 10.3 10.9 − − 0.37 GMRTJ083639+441156 08 36 39.6 44 11 56.6 22.9 − − 8.6 − − 4.0 3.8 − − 0.79 GMRTJ084204+465125 08 42 4.6 46 51 25.2 22.6 − − − − − 7.0 5.0 − − 0.60 GMRTJ083114+441118 08 31 14.7 44 11 18.8 22.3 − − − − − 4.8 4.2 − − 0.72 GMRTJ084720+443842 08 47 20.7 44 38 42.8 22.0 − − 7.8 3.6 3.4 4.3 3.1 3.6 − 0.81 GMRTJ083924+451821 08 39 24.3 45 18 21.9 21.9 4.1 − 5.3 − − 3.3 − − − 0.86 GMRTJ085335+442000 08 53 35.4 44 20 0.4 21.9 − 16.0 − − − 6.9 6.3 − − 0.55 GMRTJ083741+450514 08 37 41.6 45 5 14.3 21.9 7.5 − 10.5 6.3 − 4.1 4.8 − − 0.59 GMRTJ084950+434812 08 49 50.8 43 48 12.7 21.8 15.8 − 13.2 − − 10.6 13.2 − − 0.27

© 2009 RAS, MNRAS 000, 1–??

Deep GMRT 150 MHz observations of LBDS field 19

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ083451+443811 08 34 51.9 44 38 11.8 21.8 − − 12.1 − − 5.1 5.8 − − 0.60 GMRTJ084857+454946 08 48 57.5 45 49 46.1 21.7 24.9 − − − − 12.1 12.3 − − 0.29 GMRTJ084701+454052 08 47 1.8 45 40 52.5 21.5 − − − − − − 1.0 − − 1.38 GMRTJ084905+454132 08 49 5.6 45 41 32.0 21.5 − − − − − 5.5 4.9 − − 0.64 GMRTJ084148+444238 08 41 48.9 44 42 38.3 21.5 9.4 − 7.0 − − − − − − 0.84 GMRTJ083831+443808 08 38 31.6 44 38 8.3 21.2 8.0 − 2.3 − − − − − − 1.51 GMRTJ083814+424248 08 38 14.1 42 42 48.3 20.8 − − − − − 2.4 1.9 − − 1.01 GMRTJ083952+455527 08 39 52.6 45 55 27.2 20.8 18.3 − 8.4 − − 3.1 3.3 − − 0.86 GMRTJ084843+452214 08 48 43.4 45 22 14.0 20.8 25.8 − 8.7 − 6.6 7.3 6.9 − − 0.58 GMRTJ084537+465101 08 45 37.4 46 51 1.9 20.6 − − − − − − − − − − GMRTJ083138+444506 08 31 38.6 44 45 6.5 20.6 − − − − − 2.7 2.4 − − 0.94 GMRTJ084735+425953 08 47 35.6 42 59 53.1 20.5 − − − − − 4.9 6.9 − − 0.56 GMRTJ085130+442125 08 51 30.6 44 21 25.7 20.5 − − − − − − − − − − GMRTJ083839+444656 08 38 39.3 44 46 56.7 20.4 − − 18.1 8.3 − 6.9 3.1 − − 0.55 GMRTJ083637+460622 08 36 37.7 46 6 22.5 20.3 − − − − − 3.8 3.8 − − 0.75 GMRTJ085158+450920 08 51 58.6 45 9 20.5 20.3 14.6 − 9.2 − 7.9 9.2 8.7 − − 0.39 GMRTJ083930+455056 08 39 30.2 45 50 56.4 20.1 10.8 18.0 − − − 3.9 4.3 − − 0.73 GMRTJ085327+450407 08 53 27.0 45 4 7.3 20.1 − − − − − − − − − − GMRTJ084446+435046 08 44 46.8 43 50 46.3 20.0 14.6 − 6.7 − − 3.3 3.1 − − 0.84 GMRTJ082939+442852 08 29 39.1 44 28 52.3 20.0 − − − − − 2.9 2.1 − − 0.94 GMRTJ085326+450331 08 53 26.3 45 3 31.5 19.9 − − − − − − − − − − GMRTJ083718+460944 08 37 18.0 46 9 44.6 19.8 − − − − − 5.3 5.0 − − 0.60 GMRTJ084241+424843 08 42 41.6 42 48 43.2 19.7 − − − − − 3.8 2.8 − − 0.80 GMRTJ084520+451630 08 45 20.6 45 16 30.7 19.6 8.8 − 10.1 − − − 2.3 − − 0.82 GMRTJ084138+424404 08 41 38.0 42 44 4.6 19.6 − − − − − 3.9 4.2 − − 0.71 GMRTJ083944+445005 08 39 44.2 44 50 5.2 19.5 22.0 − 9.2 4.2 − 3.5 − − − 0.78 GMRTJ084518+450111 08 45 18.6 45 1 11.5 19.4 − − 4.3 2.7 − − − 2.3 − 0.92 GMRTJ083654+464016 08 36 54.1 46 40 16.4 19.4 − − − − − − 1.1 − − 1.27 GMRTJ084635+455030 08 46 35.5 45 50 30.2 19.4 9.2 − − − − − 2.0 − − 1.01 GMRTJ084418+461911 08 44 18.7 46 19 11.7 19.4 − − − − − 3.8 4.2 − − 0.70 GMRTJ084142+443806 08 41 42.2 44 38 6.3 19.1 4.3 − 2.9 1.5 − − 1.3 − − 1.17 GMRTJ083759+460352 08 37 59.7 46 3 52.1 18.9 − − − − − 5.1 3.4 − − 0.68 GMRTJ084859+452451 08 48 59.5 45 24 51.3 18.9 − − 10.4 − − − 2.1 − − 0.84 GMRTJ082958+445557 08 29 58.8 44 55 57.3 18.9 − − − − − − − − − − GMRTJ084901+445049 08 49 1.2 44 50 49.4 18.8 − − − − 0.3 − − − − 1.88 GMRTJ085019+451435 08 50 19.4 45 14 35.1 18.7 − − − − 0.9 − − − − 1.34 GMRTJ083825+435730 08 38 25.3 43 57 30.7 18.6 44.7 21.0 39.0 − − 17.6 18.3 − − 0.09 GMRTJ084517+464148 08 45 17.5 46 41 48.3 18.6 − − − − − − − − − − GMRTJ084949+461821 08 49 49.1 46 18 21.9 18.6 − − − − − 4.4 5.2 − − 0.60 GMRTJ083933+455435 08 39 33.0 45 54 35.2 18.5 7.4 − − − − 3.0 2.4 − − 0.85 GMRTJ083516+451951 08 35 16.1 45 19 51.2 18.4 − − − − − 2.2 2.8 − − 0.89 GMRTJ083714+462908 08 37 14.9 46 29 8.9 18.2 − − − − − − 1.7 − − 1.05 GMRTJ083838+461044 08 38 38.6 46 10 44.7 18.0 − − − − − 5.9 6.4 − − 0.48 GMRTJ084159+431638 08 41 59.2 43 16 38.9 17.9 − − − − − 4.0 4.4 − − 0.65 GMRTJ084756+453643 08 47 56.9 45 36 43.0 17.9 − − − − − 3.4 3.2 − − 0.76 GMRTJ083646+450617 08 36 46.1 45 6 17.6 17.9 − − 22.5 5.9 − 9.9 3.6 − − 0.47 GMRTJ083417+430312 08 34 17.2 43 3 12.8 17.9 − − − − − − − − − − GMRTJ083419+433029 08 34 19.0 43 30 29.3 17.8 − − − − − 4.7 3.3 − − 0.67 GMRTJ085232+453040 08 52 32.2 45 30 40.0 17.8 − 14.0 − − − 6.3 6.8 − − 0.46 GMRTJ083710+433033 08 37 10.0 43 30 33.0 17.7 − − − − − 2.4 3.2 − − 0.83 GMRTJ085335+450850 08 53 35.6 45 8 50.8 17.7 − 18.0 − − − 6.2 5.2 − − 0.55 GMRTJ084940+442159 08 49 40.7 44 21 59.4 17.7 − − − − − − − − − − GMRTJ083603+435126 08 36 3.0 43 51 26.0 17.4 − − − − − 3.9 3.0 − − 0.73 GMRTJ084743+431711 08 47 43.8 43 17 11.3 17.4 − − − − − − 1.8 − − 1.01 GMRTJ084049+425116 08 40 49.1 42 51 16.8 17.3 − − − − − 16.6 17.5 − − 0.01 GMRTJ083620+444826 08 36 20.7 44 48 26.3 17.2 5.9 − 4.3 − − − − − − 1.06 GMRTJ084418+434406 08 44 18.8 43 44 6.5 17.2 − − 6.0 − − − − − − 0.75 GMRTJ083149+455404 08 31 49.0 45 54 4.4 17.2 − − − − − 3.7 4.0 − − 0.67 GMRTJ085406+445052 08 54 6.4 44 50 52.5 17.1 − − − − − − 1.5 − − 1.09 GMRTJ085030+442904 08 50 30.9 44 29 4.6 17.1 13.2 − 8.1 3.5 3.5 4.1 3.1 − − 0.74 GMRTJ083435+460514 08 34 35.7 46 5 14.1 16.8 − − − − − 2.6 1.9 − − 0.90 GMRTJ084958+452523 08 49 58.4 45 25 23.3 16.6 − 15.0 7.2 − − 13.1 9.9 − − 0.20 GMRTJ084821+433621 08 48 21.7 43 36 21.7 16.5 − − − − − − − − − − GMRTJ084356+453454 08 43 56.4 45 34 54.6 16.4 8.6 − − − − 5.9 5.6 − − 0.45 GMRTJ084810+455638 08 48 10.6 45 56 38.7 16.4 − − − − − 3.9 3.3 − − 0.68 GMRTJ083447+435800 08 34 47.8 43 58 0.8 16.2 − − − − − 2.9 3.1 − − 0.75

© 2009 RAS, MNRAS 000, 1–??

20 C. H. Ishwara-Chandra et al.

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ083552+452857 08 35 52.7 45 28 57.7 16.0 − − − − − 3.5 2.7 − − 0.73 GMRTJ083548+440821 08 35 48.8 44 8 21.9 15.9 − − − − − 3.1 2.3 − − 0.80 GMRTJ084448+455714 08 44 48.5 45 57 14.0 15.9 − − − − − 2.7 1.8 − − 0.88 GMRTJ083928+453005 08 39 28.9 45 30 5.4 15.8 8.8 − 6.0 − − 3.4 2.8 − − 0.73 GMRTJ084111+444232 08 41 11.2 44 42 32.2 15.8 12.2 − 9.7 4.8 − 4.7 4.5 − − 0.56 GMRTJ085115+451308 08 51 15.3 45 13 8.3 15.8 − − − − 4.2 4.0 5.3 − − 0.56 GMRTJ084429+424102 08 44 29.6 42 41 2.9 15.6 − − − − − − − − − − GMRTJ084134+431421 08 41 34.5 43 14 21.1 15.4 − − − − − 4.5 3.8 − − 0.59 GMRTJ084035+445625 08 40 35.2 44 56 25.1 15.4 15.1 − 8.1 2.6 − 3.9 5.2 − − 0.68 GMRTJ083208+434003 08 32 8.4 43 40 3.7 15.3 − − − − − 3.7 4.2 − − 0.61 GMRTJ084906+440224 08 49 6.0 44 2 24.7 15.2 4.0 − 6.3 4.6 − 4.5 3.9 − − 0.47 GMRTJ084108+463341 08 41 8.3 46 33 41.8 15.1 − − − − − 4.9 5.7 − − 0.47 GMRTJ083708+450225 08 37 8.0 45 2 25.1 15.1 7.2 − 4.9 4.2 − 4.0 3.1 − − 0.60 GMRTJ085015+435833 08 50 15.5 43 58 33.3 15.0 − − 4.7 − − 4.4 4.8 − − 0.55 GMRTJ084531+445847 08 45 31.9 44 58 47.9 14.8 − − 4.0 2.2 − − 1.4 1.6 − 0.96 GMRTJ084814+454729 08 48 14.6 45 47 29.0 14.8 10.6 − − − − − − − − − GMRTJ084905+442120 08 49 5.8 44 21 20.8 14.8 6.1 − 6.6 3.4 2.8 3.5 2.6 − − 0.66 GMRTJ083359+453426 08 33 59.8 45 34 26.3 14.7 − − − − − − − − − − GMRTJ083357+453459 08 33 57.8 45 34 59.4 14.7 − − − − − − − − − − GMRTJ084051+432013 08 40 51.3 43 20 13.8 14.7 − − − − − − 2.2 − − 0.86 GMRTJ084920+460215 08 49 20.0 46 2 15.3 14.6 − − − − − − 2.2 − − 0.86 GMRTJ084637+424906 08 46 37.6 42 49 6.5 14.6 − − − − − 3.0 4.2 − − 0.63 GMRTJ085231+444530 08 52 31.4 44 45 30.0 14.6 − − − − 1.5 3.1 − − − 0.84 GMRTJ084809+455146 08 48 9.9 45 51 46.4 14.4 − − − − − 2.9 3.1 − − 0.70 GMRTJ084807+463445 08 48 7.1 46 34 45.1 14.3 − − − − − 6.2 5.5 − − 0.40 GMRTJ083208+454740 08 32 8.8 45 47 40.7 14.3 − − − − − 7.3 5.1 − − 0.38 GMRTJ084840+461119 08 48 40.0 46 11 19.1 14.2 − − − − − − − − − − GMRTJ084938+452230 08 49 38.1 45 22 30.1 14.2 7.0 − 7.2 − 3.5 3.4 3.6 − − 0.59 GMRTJ084325+431139 08 43 25.3 43 11 39.4 14.1 − − − − − 2.8 2.1 − − 0.79 GMRTJ084051+443957 08 40 51.3 44 39 57.3 14.1 31.3 28.0 83.6 187.3 − 188.6 180.3 182.3 − -1.19 GMRTJ083410+453457 08 34 10.9 45 34 57.1 14.1 − − − − − − − − − − GMRTJ083415+441148 08 34 15.7 44 11 48.7 14.0 − − − − − − − − − − GMRTJ084304+445859 08 43 4.7 44 58 59.4 14.0 3.2 − − − − − 3.4 − − 0.64 GMRTJ085050+435110 08 50 50.8 43 51 10.2 13.9 − − − − − 3.4 3.0 − − 0.66 GMRTJ084849+445547 08 48 49.3 44 55 47.3 13.9 9.9 − 11.9 4.8 6.0 5.1 4.6 − − 0.45 GMRTJ084052+434648 08 40 52.1 43 46 48.0 13.9 − − − − − 2.2 2.1 − − 0.83 GMRTJ084357+461408 08 43 57.3 46 14 8.9 13.9 − − − − − 3.3 1.5 − − 0.81 GMRTJ084918+450325 08 49 18.3 45 3 25.3 13.8 − − 4.9 − 2.0 − 1.6 − − 0.89 GMRTJ084637+442009 08 46 37.0 44 20 9.8 13.8 − − 2.9 − − − 2.1 1.8 − 0.89 GMRTJ084941+442224 08 49 41.3 44 22 24.9 13.8 − − − − − − 4.0 − − 0.55 GMRTJ083540+433257 08 35 40.1 43 32 57.5 13.6 − − − − − − 2.6 − − 0.74 GMRTJ083809+432912 08 38 9.4 43 29 12.3 13.6 22.6 − − − − 3.6 − − − 0.59 GMRTJ084915+454932 08 49 15.9 45 49 32.5 13.5 − − − − − 4.6 4.1 − − 0.51 GMRTJ083753+435032 08 37 53.1 43 50 32.2 13.4 − − − − − − − − − − GMRTJ084049+455550 08 40 49.7 45 55 50.6 13.4 − − − − − − 2.6 − − 0.72 GMRTJ084102+424246 08 41 2.0 42 42 46.3 13.3 − − − − − 4.1 3.4 − − 0.57 GMRTJ085013+451418 08 50 13.2 45 14 18.9 13.2 22.7 − − − 3.7 4.6 5.9 − − 0.60 GMRTJ083656+460556 08 36 56.5 46 5 56.1 13.2 − − − − − 5.8 3.1 − − 0.50 GMRTJ084850+434938 08 48 50.7 43 49 38.5 13.1 − − − − − − − − − − GMRTJ084524+455552 08 45 24.2 45 55 52.0 13.1 − − − − − − − − − − GMRTJ084551+443950 08 45 51.0 44 39 50.4 13.0 8.9 − 6.9 4.1 − 3.7 3.4 4.4 − 0.54 GMRTJ083803+460302 08 38 3.5 46 3 2.4 12.9 − − − − − 6.6 6.9 − − 0.29 GMRTJ084753+433654 08 47 53.2 43 36 54.7 12.9 − − − − − 6.4 − − − 0.32 GMRTJ083401+442753 08 34 1.0 44 27 53.3 12.9 − 24.0 − − − 2.8 3.0 − − 0.78 GMRTJ083326+461851 08 33 26.6 46 18 51.7 12.9 − 13.0 − − − 9.5 5.0 − − 0.29 GMRTJ084908+461735 08 49 8.8 46 17 35.6 12.9 − − − − − 6.5 2.3 − − 0.51 GMRTJ085021+440633 08 50 21.4 44 6 33.5 12.9 − − − − − − 1.2 − − 1.07 GMRTJ084936+431928 08 49 36.3 43 19 28.5 12.9 29.9 13.0 − − − 10.9 5.6 − − 0.33 GMRTJ085141+451542 08 51 41.1 45 15 42.8 12.9 − − − − 3.5 − 3.9 − − 0.56 GMRTJ084943+453750 08 49 43.2 45 37 50.6 12.8 − − − − − − 0.7 − − 1.28 GMRTJ083908+453253 08 39 8.8 45 32 53.9 12.8 9.3 − 8.8 − − 3.0 2.2 − − 0.69 GMRTJ084807+432903 08 48 7.0 43 29 3.1 12.7 − − − − − − 2.1 − − 0.81 GMRTJ083426+441052 08 34 26.3 44 10 52.0 12.7 − − − − − − − − − − GMRTJ084406+433641 08 44 6.0 43 36 41.9 12.7 − − − − − 2.3 2.3 − − 0.76 GMRTJ084006+431833 08 40 6.3 43 18 33.1 12.6 − − − − − − − − − − GMRTJ083722+445827 08 37 22.7 44 58 27.0 12.6 12.7 − 12.7 1.8 − 2.6 − − − 0.75

© 2009 RAS, MNRAS 000, 1–??

Deep GMRT 150 MHz observations of LBDS field 21

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ083453+431144 08 34 53.6 43 11 44.6 12.6 − − − − − 2.9 2.7 − − 0.67 GMRTJ083632+445510 08 36 32.0 44 55 10.3 12.6 6.0 − 5.0 3.1 − 3.3 2.2 − − 0.64 GMRTJ083701+435554 08 37 1.9 43 55 54.6 12.6 − − − − − − 1.0 − − 1.13 GMRTJ084427+444305 08 44 27.4 44 43 5.5 12.6 6.1 − 4.4 1.3 − 3.7 1.7 1.9 0.54 0.84 GMRTJ084542+452255 08 45 42.4 45 22 55.4 12.4 − − − − − − 2.6 − − 0.70 GMRTJ083833+462434 08 38 33.3 46 24 34.6 12.4 − − − − − 2.9 3.4 − − 0.61 GMRTJ083913+445331 08 39 13.1 44 53 31.4 12.4 5.9 − 3.2 − − − 2.5 − − 0.77 GMRTJ083548+450944 08 35 48.8 45 9 44.5 12.4 − − − − − − 1.2 − − 1.05 GMRTJ083532+440950 08 35 32.4 44 9 50.3 12.3 − − − − − − − − − − GMRTJ083810+454307 08 38 10.6 45 43 7.9 12.3 − − 11.4 − − 3.4 5.2 − − 0.45 GMRTJ083500+451926 08 35 0.5 45 19 26.5 12.2 − − − − − 3.9 2.7 − − 0.59 GMRTJ083619+454350 08 36 19.3 45 43 50.5 12.2 − − − − − − − − − − GMRTJ084441+442135 08 44 41.2 44 21 35.7 12.2 5.6 − 4.2 2.4 − 2.7 2.2 3.1 − 0.66 GMRTJ084337+460303 08 43 37.6 46 3 3.3 12.2 − − − − − − 2.6 − − 0.70 GMRTJ083838+452611 08 38 38.3 45 26 11.3 12.1 − − 4.9 − − 2.7 − − − 0.67 GMRTJ084658+443228 08 46 58.6 44 32 28.1 12.1 4.6 − 4.6 2.9 2.7 2.3 3.1 2.9 0.59 0.70 GMRTJ083745+434929 08 37 45.9 43 49 29.2 12.0 − − − − − 4.6 3.0 − − 0.52 GMRTJ084028+453900 08 40 28.1 45 39 0.3 11.9 − − − − − 2.2 1.8 − − 0.80 GMRTJ084721+434808 08 47 21.5 43 48 8.1 11.9 − − 7.6 − − 3.6 4.7 − − 0.46 GMRTJ083252+442559 08 32 52.0 44 25 59.7 11.9 − − − − − 3.6 3.7 − − 0.53 GMRTJ084142+431726 08 41 42.2 43 17 26.6 11.8 − − − − − 2.5 2.6 − − 0.69 GMRTJ084441+431020 08 44 41.9 43 10 20.0 11.7 − − − − − − 1.9 − − 0.81 GMRTJ084636+451359 08 46 36.7 45 13 59.3 11.6 − − 4.9 − − 3.0 1.8 − − 0.71 GMRTJ084636+443053 08 46 36.1 44 30 53.6 11.6 5.3 − 5.1 2.4 2.3 2.8 2.4 2.3 0.73 0.71 GMRTJ084851+452727 08 48 51.2 45 27 27.7 11.6 − − − − − − 2.8 − − 0.64 GMRTJ084150+435709 08 41 50.8 43 57 9.5 11.6 6.0 − − − − 3.0 2.9 − − 0.59 GMRTJ083508+433528 08 35 8.4 43 35 28.3 11.4 − − − − − − − − − − GMRTJ083416+441052 08 34 16.1 44 10 52.9 11.4 − − − − − − − − − − GMRTJ084210+442549 08 42 10.6 44 25 49.9 11.3 − − 2.7 − − − 1.4 − − 0.95 GMRTJ084451+424922 08 44 51.8 42 49 22.6 11.2 − − − − − 4.3 2.6 − − 0.54 GMRTJ083951+443712 08 39 51.9 44 37 12.3 11.2 − − 2.4 2.1 − − 3.3 − − 0.68 GMRTJ084902+450417 08 49 2.4 45 4 17.3 11.2 − − 6.0 − 2.9 − 3.3 − − 0.56 GMRTJ083402+450056 08 34 2.4 45 0 56.6 11.2 − − − − − − 2.7 − − 0.63 GMRTJ084515+435659 08 45 15.3 43 56 59.6 11.2 − − 8.3 − − 4.1 4.3 − − 0.43 GMRTJ083543+454334 08 35 43.1 45 43 34.0 11.1 − − − − − − 2.4 − − 0.68 GMRTJ084742+451726 08 47 42.4 45 17 26.8 11.0 − − − − 1.0 − − − − 1.07 GMRTJ084649+432911 08 46 49.9 43 29 11.5 11.0 − − − − − − − − − − GMRTJ084522+451108 08 45 22.8 45 11 8.7 11.0 − − − − − − 2.5 − − 0.66 GMRTJ084042+450049 08 40 42.7 45 0 49.8 10.8 − − 6.2 1.3 − 2.9 − − − 0.73 GMRTJ083607+451541 08 36 7.0 45 15 41.1 10.7 − − 5.7 − − 2.7 3.5 − − 0.55 GMRTJ084755+435739 08 47 55.0 43 57 39.0 10.7 − − 3.3 − − 2.7 1.4 − − 0.76 GMRTJ084015+440144 08 40 15.2 44 1 44.5 10.6 − − − − − − − − − − GMRTJ085009+460336 08 50 9.5 46 3 36.8 10.6 − − − − − 4.6 3.9 − − 0.41 GMRTJ083557+452910 08 35 57.0 45 29 10.3 10.5 − − − − − − − − − − GMRTJ083958+440344 08 39 58.5 44 3 44.7 10.5 12.1 − − − − 2.8 2.8 − − 0.65 GMRTJ085026+452425 08 50 26.4 45 24 25.9 10.4 − − − − − 2.1 − − − 0.72 GMRTJ083644+463103 08 36 44.6 46 31 3.0 10.4 − 40.0 − − − 148.9 145.9 − − -1.09 GMRTJ084850+435101 08 48 50.8 43 51 1.7 10.3 − − 2.4 − − − − − − 1.05 GMRTJ084455+454103 08 44 55.2 45 41 3.7 10.2 7.1 11.0 − − − 7.7 7.6 − − 0.12 GMRTJ084101+443703 08 41 1.7 44 37 3.4 10.2 3.9 − 3.8 1.3 − − 1.4 − − 0.85 GMRTJ084422+454502 08 44 22.1 45 45 2.8 10.2 6.6 − − − − 5.3 5.6 − − 0.26 GMRTJ083842+442907 08 38 42.9 44 29 7.6 10.2 5.4 − 7.2 − − 4.0 4.5 − − 0.35 GMRTJ084432+440610 08 44 32.0 44 6 10.5 10.2 7.6 − 4.7 4.4 − 3.1 2.8 − − 0.50 GMRTJ083314+453737 08 33 14.6 45 37 37.5 10.2 − − − − − − − − − − GMRTJ084047+451201 08 40 47.7 45 12 1.6 10.1 − − 3.8 − − − 2.5 − − 0.64 GMRTJ083855+440335 08 38 55.7 44 3 35.5 10.1 7.7 − 17.4 − − 4.4 2.6 − − 0.39 GMRTJ084013+440929 08 40 13.4 44 9 29.2 10.1 − − − − − − 2.7 − − 0.59 GMRTJ083345+443456 08 33 45.1 44 34 56.8 10.0 − − − − − 2.3 1.2 − − 0.80 GMRTJ085050+451256 08 50 50.2 45 12 56.9 9.9 − − − − 1.9 − 2.1 − − 0.71 GMRTJ083516+442950 08 35 16.2 44 29 50.2 9.9 − − − − − − − − − − GMRTJ083914+435718 08 39 14.6 43 57 18.3 9.8 − − − − − − − − − − GMRTJ084210+451312 08 42 10.2 45 13 12.3 9.8 − − − − − − − − − − GMRTJ084952+451621 08 49 52.8 45 16 21.3 9.8 − − − − 1.2 − 1.8 − − 0.84 GMRTJ084312+463325 08 43 12.7 46 33 25.0 9.8 − − − − − 3.0 2.1 − − 0.60 GMRTJ083836+441358 08 38 36.0 44 13 58.2 9.8 − − − − − − 2.1 − − 0.69 GMRTJ083452+454215 08 34 52.1 45 42 15.9 9.7 − − − − − 3.6 2.5 − − 0.52

© 2009 RAS, MNRAS 000, 1–??

22 C. H. Ishwara-Chandra et al.

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ083942+453007 08 39 42.7 45 30 7.7 9.7 − − 6.4 − − 4.3 5.0 − − 0.33 GMRTJ084347+440452 08 43 47.7 44 4 52.6 9.7 − − − − − − − − − − GMRTJ084246+431017 08 42 46.7 43 10 17.6 9.7 − − − − − 3.5 1.9 − − 0.58 GMRTJ084454+444620 08 44 54.5 44 46 20.1 9.7 4.9 − 2.5 1.7 − − 1.1 1.8 0.74 0.77 GMRTJ083512+433301 08 35 12.1 43 33 1.5 9.6 − − − − − 3.2 2.7 − − 0.53 GMRTJ084234+430006 08 42 34.5 43 0 6.5 9.6 − − − − − − − − − − GMRTJ084700+435807 08 47 0.6 43 58 7.2 9.5 − − 13.6 − − 4.2 − − − 0.24 GMRTJ083658+430549 08 36 58.1 43 5 49.3 9.5 − − − − − − − − − − GMRTJ083112+450525 08 31 12.2 45 5 25.0 9.5 − − − − − 7.1 7.8 − − 0.11 GMRTJ085011+460212 08 50 11.2 46 2 12.3 9.4 − − − − − − − − − − GMRTJ084218+451240 08 42 18.3 45 12 40.9 9.4 − − − − − − − − − − GMRTJ083742+461430 08 37 42.0 46 14 30.3 9.4 − − − − − − 2.1 − − 0.66 GMRTJ083714+450742 08 37 14.0 45 7 42.6 9.4 − − 5.8 4.1 − − 2.3 − − 0.48 GMRTJ084405+440756 08 44 5.8 44 7 56.4 9.3 3.4 − 3.9 − − 3.0 2.9 − − 0.47 GMRTJ084213+440637 08 42 13.9 44 6 37.7 9.2 − − − − − − 1.0 − − 1.00 GMRTJ083255+444819 08 32 55.2 44 48 19.7 9.2 − − − − − 6.0 − − − 0.19 GMRTJ084533+431352 08 45 33.8 43 13 52.5 9.1 − − − − − − − − − − GMRTJ083659+460435 08 36 59.9 46 4 35.3 9.1 − − − − − − − − − − GMRTJ084629+445322 08 46 29.7 44 53 22.6 9.0 − − − − − − − − − − GMRTJ083458+433513 08 34 58.7 43 35 13.4 9.0 − − − − − − − − − − GMRTJ083528+440120 08 35 28.0 44 1 20.9 8.9 − − − − − − − − − − GMRTJ084405+462444 08 44 5.5 46 24 44.6 8.9 − − − − − 3.8 2.6 − − 0.46 GMRTJ084814+444818 08 48 14.5 44 48 18.8 8.9 − − 4.1 1.7 1.8 2.6 − − − 0.67 GMRTJ084642+432821 08 46 42.5 43 28 21.2 8.8 − − − − − − − − − − GMRTJ084334+452102 08 43 34.5 45 21 2.7 8.8 − − − − − − 1.5 − − 0.80 GMRTJ085127+453519 08 51 27.6 45 35 19.3 8.7 − − − − − 2.3 2.8 − − 0.56 GMRTJ084546+442511 08 45 46.9 44 25 11.9 8.7 − − 3.1 2.0 − − 1.6 1.9 − 0.69 GMRTJ083758+442122 08 37 58.6 44 21 22.0 8.6 − − − − − − − − − − GMRTJ083657+460940 08 36 57.8 46 9 40.5 8.6 − − − − − − − − − − GMRTJ084059+455307 08 40 59.4 45 53 7.6 8.6 − − − − − − 3.2 − − 0.44 GMRTJ083337+441718 08 33 37.9 44 17 18.6 8.6 − − − − − 4.3 3.4 − − 0.36 GMRTJ083618+443710 08 36 18.8 44 37 10.2 8.5 − − − − − − − − − − GMRTJ084647+432816 08 46 47.6 43 28 16.9 8.5 − − − − − − − − − − GMRTJ084352+442424 08 43 52.8 44 24 24.3 8.5 4.4 − 3.6 1.8 − − − 1.6 − 0.70 GMRTJ083223+443925 08 32 23.4 44 39 25.7 8.5 − − − − − 2.5 4.0 − − 0.44 GMRTJ085015+435956 08 50 15.2 43 59 56.1 8.5 − − − − − − − − − − GMRTJ084402+450112 08 44 2.8 45 1 12.9 8.4 − − − − − − 1.3 − − 0.84 GMRTJ084457+431209 08 44 57.2 43 12 9.0 8.4 − − − − − − − − − − GMRTJ083503+440443 08 35 3.6 44 4 43.7 8.4 − − − − − − − − − − GMRTJ083540+460000 08 35 40.9 46 0 0.7 8.4 − − − − − 2.5 2.2 − − 0.57 GMRTJ084650+452438 08 46 50.8 45 24 38.8 8.3 3.9 − − − − − 1.7 − − 0.70 GMRTJ084441+461241 08 44 41.9 46 12 41.5 8.2 − − − − − − − − − − GMRTJ084430+455509 08 44 30.6 45 55 9.9 8.2 − − − − − − − − − − GMRTJ083354+434611 08 33 54.0 43 46 11.5 8.2 − − − − − − − − − − GMRTJ084348+453054 08 43 48.3 45 30 54.4 8.1 − − − − − 3.9 3.2 − − 0.37 GMRTJ083948+460922 08 39 48.4 46 9 22.6 8.1 − − − − − 3.2 2.4 − − 0.48 GMRTJ084639+432933 08 46 39.6 43 29 33.7 8.1 − − − − − − − − − − GMRTJ084834+451923 08 48 34.3 45 19 23.0 8.1 − − − − 1.9 2.5 1.1 − − 0.68 GMRTJ084138+445610 08 41 38.5 44 56 10.7 8.0 5.1 − 7.2 2.5 − − − − − 0.42 GMRTJ083923+433923 08 39 23.1 43 39 23.1 8.0 − − − − − − 0.8 − − 1.02 GMRTJ084350+430556 08 43 50.5 43 5 56.0 8.0 − − − − − − 1.2 − − 0.85 GMRTJ084029+431310 08 40 29.6 43 13 10.5 7.9 − − − − − − 1.2 − − 0.83 GMRTJ084250+455142 08 42 50.2 45 51 42.2 7.9 − − − − − − − − − − GMRTJ084626+454544 08 46 26.6 45 45 44.6 7.9 − − − − − 3.1 1.2 − − 0.61 GMRTJ083708+450952 08 37 8.5 45 9 52.0 7.9 − − 6.0 2.4 − − − − − 0.47 GMRTJ084059+454652 08 40 59.5 45 46 52.7 7.8 − − − − − 2.8 2.6 − − 0.47 GMRTJ083351+435847 08 33 51.0 43 58 47.1 7.7 − − − − − 2.8 2.8 − − 0.45 GMRTJ084615+440023 08 46 15.6 44 0 23.4 7.7 − − − − − − 2.9 − − 0.44 GMRTJ084347+435052 08 43 47.7 43 50 52.3 7.7 − − − − − − − − − − GMRTJ084333+444636 08 43 33.3 44 46 36.0 7.6 − − − 1.1 − − 1.6 0.9 − 0.82 GMRTJ084500+450433 08 45 0.9 45 4 33.0 7.6 4.9 − − − − − − − − − GMRTJ084137+454045 08 41 37.3 45 40 45.9 7.5 − − − − − − − − − − GMRTJ083910+450212 08 39 10.2 45 2 12.5 7.5 − − 3.1 2.1 − − 2.7 − − 0.53 GMRTJ083700+431658 08 37 0.5 43 16 58.2 7.5 − − − − − − 2.2 − − 0.56 GMRTJ084013+440029 08 40 13.1 44 0 29.1 7.5 − − − − − − − − − − GMRTJ083810+434929 08 38 10.9 43 49 29.2 7.4 − − − − − 3.4 1.4 − − 0.53

© 2009 RAS, MNRAS 000, 1–??

Deep GMRT 150 MHz observations of LBDS field 23

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ084326+433502 08 43 26.1 43 35 2.5 7.4 − − − − − − − − − − GMRTJ084100+431705 08 41 0.6 43 17 5.7 7.3 − − − − − − − − − − GMRTJ084030+443106 08 40 30.9 44 31 6.7 7.3 − − − − − − − − − − GMRTJ084128+443337 08 41 28.8 44 33 37.9 7.2 4.0 − 4.7 2.2 − − 3.2 − − 0.41 GMRTJ084340+443922 08 43 40.9 44 39 22.1 7.2 3.4 − − 1.0 − − 0.8 1.3 − 0.85 GMRTJ084805+433902 08 48 5.5 43 39 2.9 7.2 − − 7.4 − − − 2.3 − − 0.39 GMRTJ084547+455415 08 45 47.1 45 54 15.5 7.2 − − − − − − 1.5 − − 0.70 GMRTJ084202+431607 08 42 2.1 43 16 7.9 7.1 11.0 − − − − − − − − − GMRTJ084638+442134 08 46 38.4 44 21 34.9 7.0 − − − − − − − − − − GMRTJ084744+443443 08 47 44.3 44 34 43.8 7.0 4.1 − 4.1 1.2 1.9 − − − − 0.64 GMRTJ083642+450946 08 36 42.3 45 9 46.1 7.0 − − 2.3 1.9 − 3.6 1.0 − − 0.56 GMRTJ084520+453427 08 45 20.2 45 34 27.4 6.9 − − − − − − − − − − GMRTJ084038+461126 08 40 38.8 46 11 26.7 6.9 − − − − − − 1.5 − − 0.68 GMRTJ084223+455812 08 42 23.6 45 58 12.8 6.9 − − − − − 3.7 4.4 − − 0.24 GMRTJ084007+460242 08 40 7.3 46 2 42.1 6.9 − − − − − − − − − − GMRTJ084306+430809 08 43 6.4 43 8 9.2 6.8 − − − − − − − − − − GMRTJ084435+453947 08 44 35.8 45 39 47.1 6.8 − − − − − − 1.1 − − 0.81 GMRTJ084516+441604 08 45 16.9 44 16 4.5 6.7 − − − − − − − 0.7 − 1.03 GMRTJ083730+455550 08 37 30.6 45 55 50.7 6.7 − − − − − − 1.3 − − 0.73 GMRTJ084213+435546 08 42 13.9 43 55 46.2 6.6 − − − − − − − − − − GMRTJ084415+443852 08 44 15.0 44 38 52.4 6.6 − − 4.2 5.2 − 5.0 4.2 4.6 4.50 0.11 GMRTJ084354+431348 08 43 54.2 43 13 48.0 6.6 − − − − − − 1.5 − − 0.65 GMRTJ083910+442657 08 39 10.7 44 26 57.1 6.5 − − 3.6 − − 2.1 1.6 − − 0.56 GMRTJ084242+455707 08 42 42.5 45 57 7.6 6.5 − − − − − − − − − − GMRTJ084258+445352 08 42 58.3 44 53 52.3 6.5 − − − − − − 0.9 − − 0.88 GMRTJ084447+444435 08 44 47.1 44 44 35.9 6.5 − − 6.8 1.6 − − 3.3 1.6 0.64 0.63 GMRTJ083943+452711 08 39 43.2 45 27 11.2 6.5 5.0 − 5.5 − − − 2.4 − − 0.38 GMRTJ084001+434413 08 40 1.9 43 44 13.5 6.4 − − − − − − − − − − GMRTJ083555+444742 08 35 55.8 44 47 42.8 6.4 − − − − − − − − − − GMRTJ085031+451009 08 50 31.9 45 10 9.7 6.4 − − − − 1.3 2.4 − − − 0.56 GMRTJ084127+451717 08 41 27.4 45 17 17.5 6.3 − − − − − − − − − − GMRTJ083737+432945 08 37 37.2 43 29 45.7 6.3 − − − − − − − − − − GMRTJ084143+461654 08 41 43.8 46 16 54.5 6.2 − − − − − − − − − − GMRTJ084737+454520 08 47 37.1 45 45 20.1 6.2 13.7 − − − − 7.5 8.4 − − -0.00 GMRTJ084707+434902 08 47 7.7 43 49 2.8 6.2 − − − − − − − − − − GMRTJ084915+441122 08 49 15.7 44 11 22.4 6.2 − − 1.9 1.1 − − − − − 0.77 GMRTJ084419+452347 08 44 19.0 45 23 47.0 6.0 − − − − − − − − − − GMRTJ084143+433621 08 41 43.5 43 36 21.5 6.0 − − − − − − − − − − GMRTJ084341+431645 08 43 41.4 43 16 45.5 6.0 − − − − − − − − − − GMRTJ083515+445329 08 35 15.2 44 53 29.6 6.0 − − − − − − 3.4 − − 0.26 GMRTJ084648+453450 08 46 48.6 45 34 50.6 6.0 − − − − − − − − − − GMRTJ084150+432020 08 41 50.0 43 20 20.9 5.9 − − − − − − − − − − GMRTJ083634+450156 08 36 34.1 45 1 56.8 5.9 22.3 42.0 35.0 22.1 − 21.1 22.8 − − -0.21 GMRTJ084744+442607 08 47 44.5 44 26 7.0 5.9 7.4 − 8.3 5.0 5.5 5.1 6.0 7.3 − 0.06 GMRTJ084507+433002 08 45 7.1 43 30 2.4 5.9 − − − − − − − − − − GMRTJ083816+453759 08 38 16.0 45 37 59.5 5.8 − − 8.1 − − − − − − -0.24 GMRTJ083930+443358 08 39 30.4 44 33 58.4 5.8 − − − − − − − − − − GMRTJ083612+443333 08 36 12.5 44 33 33.2 5.8 − − 4.4 − − − 3.4 − − 0.23 GMRTJ084501+450036 08 45 1.4 45 0 36.2 5.8 − − − − − − − − − − GMRTJ084012+442400 08 40 12.4 44 24 0.3 5.7 − − 3.1 − − − 2.6 − − 0.36 GMRTJ084153+452551 08 41 53.8 45 25 51.6 5.7 6.2 − 4.8 − − 2.7 2.1 − − 0.41 GMRTJ084654+453425 08 46 54.0 45 34 25.1 5.7 − − − − − 2.9 6.5 − − 0.10 GMRTJ084445+443220 08 44 45.0 44 32 20.0 5.5 − − 3.0 0.8 − − − 0.9 0.37 0.81 GMRTJ083742+440329 08 37 42.4 44 3 29.9 5.5 − − − − − − 3.7 − − 0.18 GMRTJ084525+434305 08 45 25.1 43 43 5.2 5.5 − − − − − − − − − − GMRTJ084753+441244 08 47 53.7 44 12 44.1 5.5 46.2 − − − − − − − − − GMRTJ084007+443336 08 40 7.3 44 33 36.2 5.4 8.4 − 3.4 2.7 − − 1.0 − − 0.60 GMRTJ084211+452524 08 42 11.0 45 25 24.5 5.4 − − − − − − − − − − GMRTJ084623+453117 08 46 23.1 45 31 17.0 5.4 − − − − − − − − − − GMRTJ083924+435125 08 39 24.2 43 51 25.7 5.4 − − − − − − − − − − GMRTJ084200+435433 08 42 0.4 43 54 33.4 5.4 7.8 − 11.0 − − 12.6 12.1 − − -0.37 GMRTJ084516+443321 08 45 16.6 44 33 21.7 5.3 − − − − − − − − − − GMRTJ084757+435942 08 47 57.9 43 59 42.5 5.3 − − − − − − − − − − GMRTJ084638+452833 08 46 38.5 45 28 33.2 5.3 − − − − − 2.8 1.0 − − 0.49 GMRTJ083655+454156 08 36 55.2 45 41 56.2 5.3 − − − − − − − − − − GMRTJ084115+434947 08 41 15.5 43 49 47.2 5.2 − − − − − − 2.0 − − 0.42

© 2009 RAS, MNRAS 000, 1–??

24 C. H. Ishwara-Chandra et al.

NAME RA (J2000) DEC (J2000) S_{150} S_{327} S_{W ENSS} S_{610} S_{1412}a S_{1412}b S_{NV SS} S_{F IRST} S_{1462} S_{4860} α hh mm ss.s dd mm ss.s mJy mJy mJy mJy mJy mJy mJy mJy mJy mJy

GMRTJ084409+444743 08 44 9.2 44 47 43.2 5.1 − − − − − − − 0.5 0.72 0.66 GMRTJ084628+441741 08 46 28.5 44 17 41.5 5.1 − − 1.7 2.0 − − − − − 0.48 GMRTJ084802+452444 08 48 2.6 45 24 44.2 5.1 − − − − − − − − − − GMRTJ084003+455152 08 40 3.6 45 51 52.5 5.1 − − − − − 3.4 1.7 − − 0.32 GMRTJ084315+450212 08 43 15.0 45 2 12.6 5.0 − − − − − 2.1 2.0 − − 0.40 GMRTJ084719+452805 08 47 19.9 45 28 5.9 5.0 − − − − − − 2.5 − − 0.31 GMRTJ083818+453156 08 38 18.6 45 31 56.2 5.0 13.4 − 12.9 − − 3.3 2.8 − − 0.32 GMRTJ084201+434122 08 42 1.4 43 41 22.8 4.9 − − − − − − − − − − GMRTJ084626+442954 08 46 26.8 44 29 54.3 4.8 13.5 − 11.3 3.2 1.4 3.6 − 3.8 − 0.46 GMRTJ083918+435554 08 39 18.6 43 55 54.7 4.8 − − − − − − 1.2 − − 0.63 GMRTJ084315+452551 08 43 15.7 45 25 51.3 4.6 5.7 − − − − − − − − − GMRTJ084043+443226 08 40 43.2 44 32 26.1 4.5 − − − − − − − − − − GMRTJ084206+454114 08 42 6.3 45 41 14.2 4.5 − − − − − − − − − − GMRTJ084109+454730 08 41 9.5 45 47 30.6 4.5 − − − − − − − − − − GMRTJ083915+451226 08 39 15.2 45 12 26.4 4.3 − − − − − − − − − − GMRTJ084348+444425 08 43 48.7 44 44 25.8 4.3 − − − − − − − − − − GMRTJ084418+453032 08 44 18.4 45 30 32.0 4.3 − − − − − − − − − − GMRTJ084608+443642 08 46 8.1 44 36 42.8 4.2 − − 1.6 0.8 − − − 0.9 − 0.69 GMRTJ084009+442154 08 40 9.3 44 21 54.0 4.1 − − − − − − − − − − GMRTJ084059+434728 08 40 59.5 43 47 28.1 4.0 − − − − − − 1.0 − − 0.63 GMRTJ084529+445038 08 45 29.5 44 50 38.8 4.0 − − − 0.8 − − − 0.5 − 0.79 GMRTJ084419+440306 08 44 19.0 44 3 6.0 4.0 − − − − − − − − − − GMRTJ084101+440918 08 41 1.1 44 9 18.3 4.0 − − − − − − − − − − GMRTJ084109+441859 08 41 9.3 44 18 59.9 3.8 − − − − − − − − − − GMRTJ084338+441112 08 43 38.4 44 11 12.7 3.8 − − − − − − 1.4 − − 0.43 GMRTJ084455+440508 08 44 55.9 44 5 8.3 3.8 − − − − − − − − − − GMRTJ084258+441128 08 42 58.8 44 11 28.5 3.7 − − − − − − − − − − GMRTJ084404+443120 08 44 4.1 44 31 20.4 3.5 − − − 1.0 − − 0.7 1.2 − 0.56 GMRTJ084319+443238 08 43 19.1 44 32 38.7 3.5 − − − − − − 2.3 1.1 − 0.35