arXiv:0912.1462v2 [astro-ph.CO] 15 Mar 2010

Eight New Quasar Lenses from the Sloan Digital Sky Survey Quasar Lens Search

Issha Kayo^{1,2,3}, Naohisa Inada^4, Masamune Oguri^{5,6}, Tomoki Morokuma^{3,5}, Patrick B. Hall^7, Christopher S. Kochanek^8, Donald P. Schneider^9

ABSTRACT

We report the discovery and confirmation of eight new two-image lensed quasars by the Sloan Digital Sky Survey (SDSS) Quasar Lens Search. The lenses are SDSS J0904+1512 (image separation θ = 1.^{′′}13, source redshift z_s = 1.826), SDSS J1054+2733 (θ = 1.^{′′}27, z_s = 1.452), SDSS J1055+4628 (θ = 1.^{′′}15, z_s = 1.249), SDSS J1131+1915 (θ = 1.^{′′}46, z_s = 2.915), SDSS J1304+2001 (θ = 1.^{′′}87, z_s = 2.175), SDSS J1349+1227 (θ = 3.^{′′}00, z_s = 1.722), SDSS J1455+1447 (θ = 1.^{′′}73, z_s = 1.424), and SDSS J1620+1203 (θ = 2.^{′′}77, z_s = 1.158). Three of them, SDSS J1055+4628, SDSS J1455+1447, and SDSS J1620+1203, satisfy the criteria for constructing our statistical sample for studying the cosmological model. Based on galactic absorption lines of the lens galaxies, we also derive lens redshifts of z_l = 0.398 and z_l = 0.513 for SDSS J1620+1203 and the previously discovered lens SDSS J0746+4403, respectively.

Subject headings: gravitational lensing: strong — quasars: general

1Institute for the Physics and Mathematics of the Universe, University of Tokyo, 5-1-5 Kashiwanoha, Chiba 277-8582, Japan

2Institute of Cosmology and Gravitation, University of Portsmouth, Burnaby Road, Portsmouth, PO1 3FX, UK

3Research Fellow of the Japan Society for the Promotion of Science

4Cosmic Radiation Laboratory, RIKEN, 2-1 Hirosawa, Wako, Saitama 351-0198, Japan.

5National Astronomical Observatory, Osawa, Mitaka, Tokyo 181-8588, Japan

6Kavli Institute for Particle Astrophysics and Cosmology, Stanford University, 2575 Sand Hill Road, Menlo Park, CA 94025, USA

7Department of Physics and Astronomy, York University, 4700 Keele Street, Toronto, Ontario M3J 1P3, Canada

8Department of Astronomy, The Ohio State University, 4055 McPherson Lab, 140 West 18th Avenue, Columbus, OH 43210, USA

9Department of Astronomy and Astrophysics, Pennsylvania State University, 525 Davey Laboratory, University Park, PA 16802, USA

– 2 –

1. Introduction

Gravitationally lensed quasars play important roles not only in investigating the physical properties of lens galaxies but also in extracting cosmological information and constraining the structure of quasar accretion disks (e.g., see Schneider et al. 2006; Kochanek 2006, for reviews). To use lensed quasars for these studies, it is important to construct large samples, especially for cosmological purposes. The Cosmic Lens All-Sky Survey (CLASS; Myers et al. 2003; Browne et al. 2003) is one of the largest, with 22 lenses drawn from a sample of ∼ 16, 000 radio sources, and has provided useful constraints on the evolution of galaxies and cosmology. We are performing a systematic lensed quasar survey, the Sloan Digital Sky Survey Quasar Lens Search (SQLS; Oguri et al. 2006; Inada et al. 2008), to construct a larger sample of lensed quasars in the optical. Thus far, we have discovered 28 lensed quasars (26 are galaxy-scale lenses and two are cluster-scale lenses) and rediscovered 11 known lenses (e.g., Oguri et al. 2008b; Inada et al. 2009a, and references therein). Our current sample is now large enough for the statistical errors on cosmological parameters to be comparable to the present level of the systematic uncertainties (Oguri et al. 2008a). Larger samples of lensed quasars also allow an increasing level of “self-calibration” to constrain many of these uncertainties, particularly the velocity dispersion function of the lens galaxies and its evolution as one of the largest contributors to these systematic uncertainties (e.g., Choi et al. 2007; Matsumoto & Futamase 2008; Chae 2008).

In this paper, we report the discovery of new eight galaxy-scale lenses done by early in 2009, bringing our total sample to 47^1. We briefly describe the selection of lens candidates from the Sloan Digital Sky Survey (SDSS; York et al. 2000) in the following section, and then present the imaging and spectroscopic observations needed to confirm these candidates in Section 3. Simple mass models of the eight lenses are made in Section 4 to see whether the lensing interpretation is reasonable. Throughout the paper, we assume a standard cosmological model with matter density Ω_M = 0.26, cosmological constant Ω_Λ = 0.74, and Hubble constant H_0 = 72km s^{−1}Mpc^{−1}.

2. SDSS Data and Selection of Candidates

The SDSS-I and SDSS-II Sloan Legacy Surveys are photometric and spectroscopic surveys (Fukugita et al. 1996; Gunn et al. 1998; Lupton et al. 1999; Stoughton et al. 2002; Blanton et al. 2003; Tucker et al. 2006) covering a quarter of the all sky, using a dedicated

1Visit http://www-utap.phys.s.u-tokyo.ac.jp/~sdss/sqls/ for a list of lensed quasars in the SQLS.

– 3 –

telescope (Gunn et al. 2006) at the Apache Point Observatory in New Mexico, USA. The imaging data were processed by the photometric pipeline (Lupton et al. 2001) and carefully calibrated (Hogg et al. 2001; Smith et al. 2002; Pier et al. 2003; Ivezić et al. 2004). The spectroscopic quasar targets were selected from the imaging data according to the algorithm described by Richards et al. (2002) and cataloged in Schneider et al. (2007) and D. P. Schneider et al. (2010, in preparation). All the SDSS data are publicly available in the final Data Release 7 (Abazajian et al. 2009).

From the spectroscopically confirmed quasar catalogs we select candidates for lensed quasars using two different methods based on morphologies (morphological selection) and color (color selection). The details of the two selection methods are found in Inada et al. (2008) and Oguri et al. (2006). Morphological selection is used to find lenses with small image separations, ≲ 2.^{′′}5, which are not deblended by the SDSS pipeline, and color selection is for lenses with larger separations. Of the eight systems reported in this paper, five systems (SDSS J0904+1512, SDSS J1054+2733, SDSS J1055+4628, SDSS J1131+1915, and SDSS J1455+1447) were morphologically selected, and three (SDSS J1304+2001, SDSS J1349+1227, and SDSS J1620+1203) were color selected. The finding charts for the systems are shown in Figure 1, and the SDSS properties of the systems are listed in Table 1. Three systems, SDSS J1055+4628, SDSS J1455+1447, and SDSS J1620+1203, satisfy the criteria for our statistical sample used for cosmological studies (source redshift 0.6 < z_s < 2.2, image magnitude i < 19.1, image separation 1^{′′} < θ < 20^{′′}, flux ratio between images ΔI or Δi < 1.25; see Inada et al. 2008; Oguri et al. 2008a; Inada et al. 2009a, for the complete description).

3. Additional Imaging and Spectroscopy

The imaging observations for these lenses were performed using four instruments on the University of Hawaii 2.2 m telescope (UH88): the Tektronix 2048x2048 CCD camera (Tek2k; the pixel size is 0.^{′′}2195 pixel^{−1}), the UH8k wide-field imager (UH8k; 0.^{′′}235 pixel^{−1}), the Orthogonal Parallel Transfer Imaging Camera (OPTIC; 0.^{′′}1374 pixel^{−1}), and the Quick Infrared Camera (QUIRC; 0.^{′′}189 pixel^{−1}). The spectroscopic data and some images were taken with the Faint Object Camera and Spectrograph (FOCAS; Kashikawa et al. 2002) on the Subaru telescope. The FOCAS data were binned 2 × 2 on the detector leading to a spatial resolution of 0.^{′′}208 pixel^{−1}. The spectral resolution is R ∼ 400 − 500. Tables 2 and 3 summarize the observations.

We analyzed the imaging data using GALFIT (Peng et al. 2002). First we fit each system with two stellar components using stars near the systems as point-spread function (PSF) templates. There remained significant extended residuals between the point sources

– 4 –

after subtracting the best-fit model for all systems. We then added a galaxy modeled by a Sérsic profile to the fit and found virtually no residuals. In the left panels of Figure 2, we show the original I-band images (R-band image for SDSS J1055+4628). Most of the signal in the images arises from two point-like objects, labeled “A” and “B”. In the right panels we show the residuals, labeled “G1” or “G2”, after subtracting the two best-fit PSFs. The astrometry and photometry of the components are listed in Table 4, and the best-fit Sérsic parameters are shown in Table 5. The differences in the relative positions of these components between bands are below 0.^{′′}05 for the stellar components and 0.^{′′}2 for the extended components.

The one-dimensional spectra of the stellar components were extracted using standard IRAF^2 tasks. The spectra shown in Figure 3 and the results of the imaging observations unambiguously confirm that the eight systems are gravitationally lensed systems. The shapes of the various emission lines and continua are almost perfectly identical between the two quasars of each system. The spectrum of the fainter quasar of SDSS J1620+1203 is contaminated with the relatively bright lens galaxy, and we clearly detect some galactic absorption lines of the lens galaxy. We conclude with comments on individual lens system.

SDSS J0904+1512. The I-band image shows that the lens galaxy is located near the brighter lens image, like HE1104-1805 (Wisotzki et al. 1993) or SDSS J1226-0006 (Inada et al. 2008), and a fit to the galaxy profile yields the Sérsic index of 4.1. When analyzing V - and R-band images, we fixed the galaxy profile to the I-band profile because the galaxy is too faint to fit the galaxy profile correctly. The image separation is θ = 1.^{′′}128 ± 0.^{′′}007, and the source redshift is z_s = 1.826 ± 0.002. This lens system is not included in the SQLS statistical sample because of the large flux ratio between the quasar images (ΔI > 1.25; Inada et al. 2008).

SDSS J1054+2733. The best-fit Sérsic index to the galaxy is 3.7 in the I-band, and the lens galaxy is likely to be early-type. For the R-band analysis, we fixed the galaxy profile to that from the I-band fit. Although there remain some residuals in the 2PSFs model of the V -band image, we could not fit the residuals well because of a lack of bright enough PSF templates to fit the weak residuals. The image separation is θ = 1.^{′′}269 ± 0.^{′′}004 and the source redshift is z_s = 1.452 ± 0.002. This system is not included in the SQLS statistical sample because of the large flux ratio between the images.

2IRAF is distributed by the National Optical Astronomy Observatories, which are operated by the Association of Universities for Research in Astronomy, Inc., under cooperative agreement with the National Science Foundation.

– 5 –

SDSS J1055+4628. The FOCAS R-band image was used for astrometric measurements because it is the deepest. In addition to the two quasars (A and B) and the lens galaxy (G1 with a best-fit Sérsic index of 5.4), we also found two extended objects located 3.^{′′}5 to the north and 4^{′′} to the south of the system. The northern object has R − I ∼ 1.0, which is similar to the lens galaxy G1 (R − I = 0.87), but the southern one is much bluer than the two galaxies. In the V -band image we could not find any galaxy components. The image separation is θ = 1.^{′′}146 ± 0.^{′′}004 and the source redshift is z_s = 1.249 ± 0.001. This system satisfies our statistical sample criteria and is included in SQLS statistical sample from DR5 (N. Inada et al. 2010, in preparation).

SDSS J1131+1915. The lens galaxy was successfully fit in the I band image with the Sérsic profile (the best-fit index is 2.4), but the V -band residuals after subtracting two PSFs are faint and we could not estimate the parameters of the galaxy. We did not take R-band images. The image separation is θ = 1.^{′′}462 ± 0.^{′′}007 and the source redshift is z_s = 2.915 ± 0.001. This system is not included in the SQLS statistical sample because the redshift is outside of our selection criteria (z_s < 2.2).

SDSS J1304+2001. We fit the images with two PSFs (A and B) and two Sérsic profiles (G1 and G2), and the best-fit Sérsic indices are 2.9 and 6.0, respectively. Galaxy G1 lies between the two quasars and galaxy G2 is located about 3.^{′′}5 to the south of G1. G1 and G2 have similar, red colors (R − I = 0.7 ∼ 1.0 and V − R = 0.8 ∼ 0.9), suggesting that they are probably associated with each other. The image separation is θ = 1.^{′′}865 ± 0.^{′′}004 and the source redshift is z_s = 2.175 ± 0.002. This system is not included in the SQLS statistical sample because of the large flux ratio between the images.

SDSS J1349+1227. Although this system had been reported as a binary quasar in Hennawi et al. (2006), our new observations suggest that it is a gravitational lens rather than a binary quasar. We detected a lens galaxy very close to the fainter quasar component with a best-fit Sérsic index of 1.7. Because the galaxy is faint in the R- and V -bands, we fixed the galaxy parameters to the best-fit values from the I-band. The image separation is θ = 3.^{′′}002±0.^{′′}004 and the source redshift is z_s = 1.722±0.002. This system is not included in the SQLS statistical sample because the flux ratio is slightly outside of our selection criteria (N. Inada et al. 2010, in preparation).

SDSS J1455+1447. We fit the I-band image with two PSFs and a galaxy, and the bestfit Sérsic index was 3.5. As in the case of SDSS J1349+1227, we fixed the galaxy profile in

– 6 –

R and V to the best-fit values from the I-band. The image separation is θ = 1.^{′′}727 ± 0.^{′′}004 and the source redshift is z_s = 1.424 ± 0.001. This system will be included in the SQLS DR7 statistical sample (N. Inada et al. 2010, in preparation).

SDSS J1620+1203. The lens galaxy is bright and close to the faint quasar, and the spectral features of the galaxy are seen in the spectrum of the faint quasar. In fact, the fainter quasar image was classified as a galaxy in the SDSS due to the bright lens galaxy. Ca II H&K , Mg, and Na galactic absorption lines are observed, giving a lens galaxy redshift of z_l = 0.398 ± 0.001. The image separation is θ = 2.^{′′}765 ± 0.^{′′}011 and the source redshift is z_s = 1.158 ± 0.002. The best-fit Sérsic index of 6.62 ± 2.53 is larger than is expected (Blanton et al. 2005), but we do not take it seriously because of the large error. This system will be included in the SQLS DR7 statistical sample (N. Inada et al. 2010, in preparation).

4. Mass Modeling

We modeled all eight systems to see whether the lensing hypothesis is reasonable from the theoretical point of view. Because of the small number of observational constraints for two image lenses, we limited the model to a singular isothermal ellipsoid (SIE) without any external shear. This mass model has five parameters: the lens position, the Einstein radius R_E , ellipticity e, and position angle θ_e (measured east of north). If we fit the relative positions and the image flux ratio, these two image lenses provide only five constraints, so our model has no degrees of freedom and we can find a perfectly fitting model with χ^2 ∼ 0 as long as the model is reasonable. To find the best-fit mass models, we used the glafic software (M. Oguri, in preparation; version 1.0). We used the positions and I-band fluxes in Table 4. Only one lens galaxy was considered even if there are nearby galaxies that could appreciably affect the lens potentials, as in the case of SDSS J1055+4628 and SDSS J1304+2001. The resulting parameters are summarized in Table 6. As expected, the fitting was done with χ^2 ∼ 0 for all lens systems.

We estimated likely redshifts of the lens galaxies from the observed I-band magnitudes using the modified Faber–Jackson relation of Rusin et al. (2003). The estimated redshifts and the expected V - and R-band magnitudes at the redshifts are listed in Table 7. For SDSS J1620+1203 we list the spectroscopically confirmed redshift. Considering the scatter of the relation, ∼ 0.5 mag, the predicted magnitudes agree well with the observations, except for SDSS J0904+1512 and SDSS J1349+1227. The lens galaxy of SDSS J0904+1512 is bright in the I-band, which makes the expected redshift lower than suggested by the colors. The red colors of the lens galaxy, R − I = 1.13 and V − R = 1.46, suggest that it is

– 7 –

an early-type galaxy at z ∼ 0.5 (Fukugita et al. 1995). For SDSS J1349+1227, luminosity profile indicates that it might be a late-type galaxy, which may cause the discrepancy. For comparison we also list redshifts estimated by matching R − I color of the lens galaxies to the Coleman, Wu, & Weedman (1980) early-type galaxy template. The results are fairly consistent with the estimates from the Faber–Jackson relation except for SDSS J1455+1447, where the disagreement would be solved if observed R-band magnitude were ∼ 0.5 brighter. We did not pursue these discrepancies further because the image quality is not adequate for a detailed investigation. In Table 6 we list the predicted time delays using the Faber–Jackson redshift estimates from Table 7 and the measured redshift for SDSS J1620+1203.

5. Summary

As part of the SQLS project we discovered eight new gravitationally lensed quasars: SDSS J0904+1512, SDSS J1054+2733, SDSS J1055+4628, SDSS J1131+1915, SDSS J1304+2001, SDSS J1349+1227, SDSS J1455+1447, and SDSS J1620+1203. All eight lenses are twoimage quasar lenses produced by galaxy-scale lens potentials. They were confirmed to be lenses by imaging and spectroscopic observations using the UH88 and Subaru telescopes. Simple mass models also suggest that the observed image configurations and fluxes are reasonable for lens systems. For SDSS J1620+1203, the redshift of the lens galaxy was determined from the absorption lines in the spectrum of the fainter quasar. The system configuration is summarized in Table 4.

Adding the eight systems reported in this paper, the SQLS has discovered 36 quasar lenses and rediscovered 11 known lenses. Among the eight new lenses, SDSS J1055+4628 will be included in the DR5 statistical lens catalog (N. Inada et al. 2010, in preparation), and SDSS J1455+1447 and SDSS J1620+1203 will be in the final DR7 statistical lens catalog of the SQLS (N. Inada et al. 2010, in preparation).

Use of the UH 2.2 m telescope for the observations is supported by the National Astronomical Observatory of Japan. This work is based in part on data collected at Subaru Telescope, which is operated by NAOJ. I. K. acknowledges support by Grant-in-Aid for Scientific Research on Priority Areas No. 467 and World Premier International Research Center Initiative (WPI Initiative), MEXT, Japan. N. I. acknowledges support from the Special Postdoctoral Researcher Program of RIKEN, the RIKEN DRI Research Grant, and MEXT KAKENHI 21740151. This work was supported in part by Department of Energy contract DE-AC02-76SF00515. I. K. and T. M. are financially supported by the Japan Society for the Promotion of Science Research Fellowship. C. S. K. is supported by NSF grant

– 8 –

AST-0708082.

Funding for the SDSS and SDSS-II has been provided by the Alfred P. Sloan Foundation, the Participating Institutions, the National Science Foundation, the U.S. Department of Energy, the National Aeronautics and Space Administration, the Japanese Monbukagakusho, the Max Planck Society, and the Higher Education Funding Council for England. The SDSS Web Site is http://www.sdss.org/.

The SDSS is managed by the Astrophysical Research Consortium for the Participating Institutions. The Participating Institutions are the American Museum of Natural History, Astrophysical Institute Potsdam, University of Basel, University of Cambridge, Case Western Reserve University, University of Chicago, Drexel University, Fermilab, the Institute for Advanced Study, the Japan Participation Group, Johns Hopkins University, the Joint Institute for Nuclear Astrophysics, the Kavli Institute for Particle Astrophysics and Cosmology, the Korean Scientist Group, the Chinese Academy of Sciences (LAMOST), Los Alamos National Laboratory, the Max-Planck-Institute for Astronomy (MPIA), the Max-Planck-Institute for Astrophysics (MPA), New Mexico State University, Ohio State University, University of Pittsburgh, University of Portsmouth, Princeton University, the United States Naval Observatory, and the University of Washington.

A. LENS REDSHIFT OF SDSS J0746+4403

We also measured the lens redshift of SDSS J0746+4403 (Inada et al. 2007), one of the lensed quasars included in our statistical lens sample, using the Subaru telescope. We obtained a deep (total 2700 s exposure) spectrum of this lens with FOCAS on 21st January 2007. We used the 300B grism, the SY47 filter and a 1.^{′′}0-width slit aligned along the A and B lensed images. The data were binned 2×2 on-chip. The seeing was less than 1.^{′′}0 during the exposure. The two-dimensional spectrum of the system is shown in the left panel of Figure 4. In order to minimize the influence of the lensed images, we extracted a onedimensional spectrum between the peaks of lensed images A and B (see Figure 4), using standard IRAF tasks. Although there remains some contamination from the lensed quasar images, we can clearly see galactic absorption lines of the lensing galaxy. The lens redshift is measured to be z_l = 0.513 from the redshifted Ca II H&K and G-band absorption lines at about 5950Å, 6000Å, and 6500Å, respectively.

– 9 –

REFERENCES Abazajian, K. N., et al. 2009, ApJS, 182, 543 Blanton, M. R., Lin, H., Lupton, R. H., Maley, F. M., Young, N., Zehavi, I., & Loveday, J.

2003, AJ, 125, 2276 Blanton, M. R., Eisenstein, D., Hogg, D. W., Schlegel, D. J., & Brinkmann, J. 2005, ApJ, 629, 143 Browne, I. W. A., et al. 2003, MNRAS, 341, 13 Chae, K.-H. 2008, MNRAS, 402, 2031 Choi, Y.-Y., Park, C., & Vogeley, M. S. 2007, ApJ, 658, 884 Coleman, G. D., Wu, C.-C., & Weedman, D. W. 1980, ApJS, 43, 393 Fukugita, M., Ichikawa, T., Gunn, J. E., Doi, M., Shimasaku, K., & Schneider, D. P. 1996, AJ, 111, 1748 Fukugita, M., Shimasaku, K., & Ichikawa, T. 1995, PASP, 107, 945 Gunn, J. E., et al. 1998, AJ, 116, 3040 Gunn, J. E., et al. 2006, AJ, 131, 2332 Hennawi, J.F., et al. 2006, AJ, 131, 1 Hogg, D. W., Finkbeiner, D. P., Schlegel, D. J., & Gunn, J. E. 2001, AJ, 122, 2129 Inada, N., et al. 2007, AJ, 133, 206 Inada, N., et al. 2008, AJ, 135, 496 Inada, N., et al. 2009a, AJ, 137, 4118 Inada, N., et al. 2009b, in preparation Ivezić, Ž., et al. 2004, Astron. Nachr, 325, 583 Kashikawa, N., et al. 2002, PASJ, 54, 819 Kochanek, C.S., 2006, in Gravitational Lensing: Strong Weak and Micro, Saas-Fee Advanced Course 33, G. Meylan, P. North, P. Jetzer, eds., (Springer: Berlin) 91

– 10 –

Lupton, R., Gunn, J. E., Ivezić, Z., Knapp, G. R., Kent, S., & Yasuda, N. 2001, in ASP Conf.

Ser. 238, Astronomical Data Analysis Software and Systems X, ed. F. R. Harnden, Jr., F. A. Primini, and H. E. Payne (San Francisco: ASP), 269 Lupton, R. H., Gunn, J. E., & Szalay, A. S. 1999, AJ, 118, 1406 Matsumoto, A. & Futamase, T. 2008, MNRAS, 384, 843 Myers, S. T., et al. 2003, MNRAS, 341, 1 Oguri, M., et al. 2006, AJ, 132, 999 Oguri, M., et al. 2008a, AJ, 135, 512 Oguri, M., et al. 2008b, MNRAS, 391, 1973 Peng, C. Y., Ho, L. C., Impey, C. D., & Rix, H.-W. 2002, AJ, 124, 266 Pier, J. R., Munn, J. A., Hindsley, R. B., Hennessy, G. S., Kent, S. M., Lupton, R. H., & Ivezić, Ź. 2003, AJ, 125, 1559 Richards, G. T., et al. 2002, AJ, 123, 2945 Rusin, D., et al. 2003, ApJ, 587, 143 Schneider, D. P., et al. 2007, AJ, 134, 102 Schneider, D. P., et al. 2009, in preparation Schneider, P., Kochanek, C.S., & Wambsganss, J. 2006, in Gravitational Lensing: Strong, Weak and Micro, Saas-Fee Advanced Course 33, G. Meylan, P. North, P. Jetzer, eds., (Springer: Berlin) Smith, A., et al. 2002, AJ, 123, 2121 Stoughton, C., et al. 2002, AJ, 123, 485 Tucker, D. L., et al. 2006, Astron. Nachr, 327, 821 Wisotzki, L., Koehler, T., Kayser, R., Reimers, D. 1993, A&A, 278, L15 York, D. G., et al. 2000, AJ, 120, 1579

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 11 –

Fig. 1.— SDSS i-band images of the eight lens systems. The size of each image is 2^′ × 2^′, and north is up and east is left.

– 12 –

Fig. 2.— Images taken by the UH88 and Subaru telescopes (left panels of each) and the residuals after fitting and subtracting two PSFs using GALFIT (right panels of each). The residual objects labeled by “G1” or “G2” are the lens galaxies. These are Tek2k I-band images except for SDSS J0904+1512 (I band, OPTIC) and SDSS J1055+4628 (R band, FOCAS). The size of the images is approximately 8^{′′} × 8^{′′}, and north is up and east is left.

– 13 –

Fig. 3.— FOCAS spectra of the eight lens systems. The flux density units are 10^{−17}erg cm^{−2}s^{−1}Å^{−1}. For SDSS J1055+4628, two exposures were merged at ∼5850Å. Absorption lines from the lens galaxy are observed in the spectrum of the fainter image of SDSS J1620+1203. Absorption lines by some intervening systems are also observed in SDSS J0904+1512 (Mg II and Fe II at z = 1.2168 ± 0.0002), SDSS J1054+2733 (Mg II and Fe II at z = 0.6794 ± 0.0002), SDSS J1131+1915 (Fe II at z = 1.1890 ± 0.0005 and a DLA at z = 2.6025 ± 0.0002 with Si II, O I, and C II), and SDSS J1349+1227 (Fe II at z = 1.2347 ± 0.0002 and z = 1.2385 ± 0.0002). The features at ∼6900Å and ∼7600Å are telluric.

– 14 –

Fig. 4.— Section of the two-dimensional FOCAS spectrum (left) of SDSS J0746+4403 (Inada et al. 2007) and the one-dimensional spectrum (right) extracted from the central region shown in the left panel, denoted by the two dashed lines. We can clearly see the Ca II H&K and G-band absorption lines from the lens galaxy at z_l = 0.513, in the right panel.

– 15 –

Table 1. SDSS Properties of the Lens Systems

Object R.A.(J2000) Decl.(J2000) u g r i z redshift

SDSS J0904+1512 09:04:04.15 +15:12:54.5 17.93±0.02 17.77±0.02 17.80±0.01 17.58±0.01 17.54±0.02 1.826±0.002 SDSS J1054+2733 10:54:40.83 +27:33:06.4 17.16±0.02 16.93±0.02 16.95±0.02 16.84±0.02 16.89±0.02 1.452±0.002 SDSS J1055+4628 10:55:45.45 +46:28:39.4 19.38±0.04 19.28±0.02 18.79±0.03 18.78±0.02 18.79±0.04 1.249±0.001 SDSS J1131+1915 11:31:57.72 +19:15:27.7 19.90±0.04 18.23±0.02 18.00±0.02 18.04±0.04 17.85±0.03 2.915±0.001 SDSS J1304+2001 13:04:43.58 +20:01:04.2 18.93±0.02 18.66±0.02 18.70±0.03 18.49±0.03 18.33±0.03 2.175±0.002 13:04:43.60 +20:01:05.8 21.08±0.32 20.45±0.35 19.98±0.19 19.93±0.23 19.44±0.12 · · · SDSS J1349+1227 13:49:29.84 +12:27:06.8 17.99±0.02 17.85±0.02 17.79±0.02 17.51±0.03 17.53±0.03 1.722±0.002 13:49:30.00 +12:27:08.7 19.70±0.22 19.32±0.17 19.11±0.12 18.73±0.13 18.62±0.13 · · · SDSS J1455+1447 14:55:01.91 +14:47:34.8 19.53±0.03 19.11±0.02 18.61±0.01 18.30±0.02 18.04±0.03 1.424±0.001 SDSS J1620+1203 16:20:26.14 +12:03:42.0 19.82±0.04 19.70±0.03 19.26±0.04 19.21±0.05 19.23±0.09 1.158±0.002 16:20:26.27 +12:03:40.3 21.30±0.13 20.76±0.12 19.90±0.08 19.52±0.06 19.23±0.07 · · ·

Note. — Magnitudes are PSF magnitudes without Galactic extinction corrections. The two images of SDSS J1304+2001 and SDSS J1349+1227 are split by the SDSS pipeline. The fainter quasar in SDSS J1620+1203 is overlapped by the bright lens galaxy and classified as a galaxy by the SDSS software.

– 16 –

Table 2. Imaging Observations

Object Imager Date of Observation (UT) Exposure Time (sec)

SDSS J0904+1512 Tek2k(V R), OPTIC(I) 12/Apr/07(V ), 20/Jan/09(R), 4/May/06(I) 300(V ), 600(R), 800(I) SDSS J1054+2733 Tek2k(V RI) 12/Apr/07(V R), 16/Nov/06(I) 300(V ), 200(R), 600(I) SDSS J1055+4628 UH8k(V ), Tek2k(BI), FOCAS(R) 13/Nov/07(B), 18/Nov/04(V ), 1/Feb/09(R), 12/Nov/07(I) 400(B), 360(V ), 120(R), 400(I) SDSS J1131+1915 Tek2k(V Iz^′) 12/Apr/07(V ), 16/Apr/07(Iz^′ ) 300(V ), 800(I), 800(z^′) SDSS J1304+2001 Tek2k(V RI) 7/Mar/08(V RI) 400(V ), 400(R), 400(I) SDSS J1349+1227 Tek2k(V RI), QUIRC(H) 16/Apr/09(V RI), 22/Feb/05(H) 400(V ), 400(R), 400(I), 1080(H) SDSS J1455+1447 Tek2k(V RI) 16/Apr/09(V RI) 300(V ), 300(R), 400(I) SDSS J1620+1203 Tek2k(V RI) 16/Apr/09(V RI) 400(V ), 300(R), 300(I)

Note. — Date of observation is the UT date when the exposures were started.

– 17 –

Table 3. FOCAS Spectroscopic Observations

Object slit width grism filter wavelength coverage (Å) R Date of Observation (UT) Exposure time (sec)

SDSS J0904+1512 1^{′′} 300B SY47 4700-9100 400 23/Jan/07 1000 SDSS J1054+2733 1^{′′} 300B L600 3700-6000 400 1/Feb/09 480 SDSS J1055+4628 (red) 0.8^{′′} 300R SO58 5800-10000 500 7/May/08 300 SDSS J1055+4628 (blue) 1^{′′} 300B L600 3700-6000 400 1/Feb/09 720 SDSS J1131+1915 1^{′′} 300B L600 3700-6000 400 1/Feb/09 720 SDSS J1304+2001 1^{′′} 300B L600 3700-6000 400 1/Feb/09 720 SDSS J1349+1227 1^{′′} 300B L600 3700-6000 400 1/Feb/09 480 SDSS J1455+1447 1^{′′} 300B L600 3700-6000 400 1/Feb/09 480 SDSS J1620+1203 1^{′′} 300B SY47 4700-9100 400 1/Feb/09 720

– 18 –

Table 4. Relative Astrometry and Absolute Photometry of Lens Systems

Component Δ X (arcsec) Δ Y (arcsec) V R I

SDSS J0904+1512 (θ = 1.^{′′}128 ± 0.^{′′}007)

A 0.000±0.003 0.000±0.003 18.18±0.01 17.88±0.01 17.71±0.04 B −0.988±0.007 −0.544±0.004 20.15±0.02 19.89±0.04 19.13±0.02 G1 −0.217±0.033 −0.091±0.018 21.19±0.12 19.73±0.07 18.60±0.07 SDSS J1054+2733 (θ = 1.^{′′}269 ± 0.^{′′}004)

A 0.000±0.002 0.000±0.002 17.21±0.01 17.09±0.01 16.94±0.01 B −1.260±0.004 0.149±0.004 19.22±0.01 18.98±0.01 18.82±0.02 G1 −0.391±0.042 −0.048±0.018 · · · 19.13±0.03 18.75±0.05 SDSS J1055+4628 (θ = 1.^{′′}146 ± 0.^{′′}004)

A 0.000±0.002 0.000±0.002 20.02±0.01 19.17±0.01 18.98±0.01 B −0.024±0.013 1.146±0.004 21.07±0.01 20.67±0.03 20.17±0.04 G1 −0.136±0.033 0.871±0.040 · · · 20.60±0.10 19.73±0.05 SDSS J1131+1915 (θ = 1.^{′′}462 ± 0.^{′′}007)

A 0.000±0.002 0.000±0.002 18.51±0.01 · · · 17.91±0.02 B −1.455±0.007 −0.145±0.004 20.53±0.02 · · · 19.62±0.02 G1 −0.378±0.079 −0.013±0.020 · · · · · · 19.45±0.07 SDSS J1304+2001 (θ = 1.^{′′}865 ± 0.^{′′}004)

A 0.000±0.002 0.000±0.002 18.70±0.01 18.54 ± 0.01 18.05±0.01 B -0.116±0.004 1.861±0.004 20.23±0.01 20.04 ± 0.01 19.61±0.02 G1 0.092±0.009 1.225±0.015 20.68±0.16 19.71 ± 0.01 18.74±0.08 G2 -1.245±0.009 -1.951±0.007 20.42±0.14 19.58 ± 0.23 18.96±0.17 SDSS J1349+1227 (θ = 3.^{′′}002 ± 0.^{′′}004)

A 0.000±0.002 0.000±0.002 17.79±0.01 17.59±0.01 17.14±0.01 B −2.335±0.004 1.886±0.004 19.30±0.01 19.01±0.01 18.49±0.01 G1 −2.105±0.048 1.727±0.037 20.99±0.09 20.71±0.06 19.35±0.05 SDSS J1455+1447 (θ = 1.^{′′}727 ± 0.^{′′}004)

A 0.000±0.002 0.000±0.002 19.50±0.02 18.83±0.01 18.25±0.01 B 1.578±0.004 0.702±0.004 20.30±0.02 19.83±0.02 19.00±0.01 G1 0.591±0.031 0.400±0.015 20.29±0.08 19.62±0.03 18.51±0.07 SDSS J1620+1203 (θ = 2.^{′′}765 ± 0.^{′′}011)

A 0.000±0.004 0.000±0.002 20.07±0.01 19.12±0.01 18.64±0.01 B −2.080±0.011 −1.822±0.011 21.30±0.07 20.73±0.10 19.94±0.05 G1 −1.756±0.013 −1.449±0.013 20.10±1.16 18.49±0.29 17.59±0.45

Note. — Positions of each component were derived from the I-band images, except for the R-band image used for SDSS J1055+4628. The positive directions of X and Y are west

– 19 –

and north, respectively. SDSS J1131+1915 was not observed in the R-band. The V -band fluxes of the lens galaxies of SDSS J1054+2733, SDSS J1055+4628, and SDSS J1131+1915 are too faint to be measured. The errors on the positions and fluxes include only statistical errors reported by GALFIT. The errors on the image separation were calculated on the assumption that the position uncertainties are all uncorrelated.

– 20 –

Table 5. Luminosity Profile of Lens Galaxies

Object r_e^a (^{′′}) n^b e^c θ_e^d (deg)

SDSS J0904+1512 0.26 ± 0.03 4.11 ± 1.04 0.49 ± 0.04 −20 ± 5 SDSS J1054+2733 0.42 ± 0.04 3.67 ± 0.75 0.42 ± 0.04 −88 ± 5 SDSS J1055+4628 0.53 ± 0.05 5.42 ± 1.53 0.07 ± 0.04 +28 ± 22 SDSS J1131+1915 0.14 ± 0.04 2.38 ± 1.22 0.82 ± 0.82 −15 ± 11 SDSS J1304+2001 0.54 ± 0.02 2.90 ± 0.45 0.42 ± 0.03 +58 ± 4 SDSS J1349+1227 1.06 ± 0.13 1.69 ± 0.52 0.24 ± 0.06 +71 ± 11 SDSS J1455+1447 1.49 ± 0.20 3.50 ± 0.54 0.28 ± 0.04 −76 ± 5 SDSS J1620+1203 3.70 ± 3.20 6.62 ± 2.53 0.25 ± 0.03 −21 ± 4

Note. — Sérsic parameters measured in the I band images (R band for SDSS J1055+4628) using GALFIT.

aEffective radius of the Sérsic profile.

bSérsic index.

cEllipticity.

dMajor axis position angle measured east of north.

– 21 –

Table 6. Mass Models of Lenses

Object R_{Ein}(^{′′}) e θ_e(deg) μ_{tot}^a Δt^b (day)

SDSS J0904+1512 0.529 ± 0.007 0.72 ± 0.05 +31 ± 2 6.9 ± 1.0 9.1 ± 0.6 SDSS J1054+2733 0.598 ± 0.004 0.52 ± 0.06 −14 ± 1 12.7 ± 2.2 10.1 ± 1.2 SDSS J1055+4628 0.600 ± 0.016 0.37 ± 0.08 −49 ± 7 3.4 ± 0.5 23.4 ± 2.2 SDSS J1131+1915 0.680 ± 0.006 0.58 ± 0.09 +5 ± 1 10.2 ± 1.9 22.4 ± 3.3 SDSS J1304+2001 0.987 ± 0.008 0.23 ± 0.02 +27 ± 3 7.9 ± 0.8 24.0 ± 0.9 SDSS J1349+1227 1.399 ± 0.010 0.57 ± 0.09 −42 ± 4 2.0 ± 0.1 450.1 ± 8.8 SDSS J1455+1447 0.853 ± 0.004 0.16 ± 0.03 +10 ± 2 12.7 ± 2.0 11.0 ± 1.4 SDSS J1620+1203 1.353 ± 0.021 0.23 ± 0.06 +21 ± 10 2.8 ± 0.1 179.3 ± 2.0

Note. — Errors are estimated from 1000 random data for each system with scatter in Table 4 for positions and 0.2 mag for image magnitudes. We used the redshifts estimated by the Faber–Jackson relation in Table 7 to compute the predicted time delays, or the measured redshift for SDSS J1620+1203. We do not include the uncertainty of the redshift for the error estimate.

aTotal magnification.

bTime delay.

– 22 –

Table 7. Predicted Redshifts and Apparent V and R Magnitudes of Lens Galaxies

Object V R Redshift (FJ) Redshift (R − I)

SDSS J0904+1512 20.1 (21.2) 19.1 (19.7) 0.19 0.54 SDSS J1054+2733 20.3 (· · ·) 19.3 (19.1) 0.23 –^b SDSS J1055+4628 21.6 (· · ·) 20.5 (20.6) 0.39 0.38 SDSS J1131+1915 21.2 (· · ·) 20.1 (· · ·) 0.32 · · · SDSS J1304+2001 20.5 (20.4) 19.3 (19.6) 0.32 0.46 SDSS J1349+1227 21.7 (21.0) 20.3 (20.7) 0.63 0.66 SDSS J1455+1447 20.2 (20.3) 19.0 (19.6) 0.27 0.53 SDSS J1620+1203 20.2 (20.1) 18.9 (18.5) 0.398^a 0.41

Note. — Values in parenthesis are the observed magnitude in Table 4. The typical uncertainties of redshift (FJ) and redshift (R − I) are ∼ 0.1, considering 0.5 mag and 0.1 mag scatter for luminosity and color of galaxies, respectively.

aRedshift of SDSS J1620+1203 is measured spectroscopically and I-band magnitude is estimated to be 18.3 at this redshift. FJ estimate will be 0.27 to recover the observed I-band magnitude of 17.59.

bR − I color is too blue to match the template.