arXiv:0911.3426v1 [astro-ph.SR] 18 Nov 2009

Mon. Not. R. Astron. Soc. 000, 1–?? (2009) Printed 26 November 2018 (MN L^ATEX style file v2.2)

Target selection for the SUNS and DEBRIS surveys for debris discs in the solar neighbourhood

N. M. Phillips^1, J. S. Greaves^2, W. R. F. Dent^3, B. C. Matthews^4 W. S. Holland^3, M. C. Wyatt^5, B. Sibthorpe^3

1Institute for Astronomy (IfA), Royal Observatory Edinburgh, Blackford Hill, Edinburgh, EH9 3HJ 2School of Physics and Astronomy, University of St. Andrews, North Haugh, St. Andrews, Fife, KY16 9SS 3UK Astronomy Technology Centre (UKATC), Royal Observatory Edinburgh, Blackford Hill, Edinburgh, EH9 3HJ 4Herzberg Institute of Astrophysics (HIA), National Research Council of Canada, Victoria, BC, Canada 5Institute of Astronomy (IoA), University of Cambridge, Madingley Road, Cambridge, CB3 0HA

Accepted 2009 September 2. Received 2009 July 27; in original form 2009 March 31

ABSTRACT Debris discs – analogous to the Asteroid and Kuiper-Edgeworth belts in the Solar system – have so far mostly been identified and studied in thermal emission shortward of 100 μm. The Herschel space observatory and the SCUBA-2 camera on the James Clerk Maxwell Telescope will allow efficient photometric surveying at 70 to 850 μm, which allow for the detection of cooler discs not yet discovered, and the measurement of disc masses and temperatures when combined with shorter wavelength photometry. The SCUBA-2 Unbiased Nearby Stars (SUNS) survey and the DEBRIS Herschel Open Time Key Project are complimentary legacy surveys observing samples of ∼500 nearby stellar systems. To maximise the legacy value of these surveys, great care has gone into the target selection process. This paper describes the target selection process and presents the target lists of these two surveys.

Key words: solar neighbourhood – stars: statistics – circumstellar matter – surveys – stars: distances

1 INTRODUCTION

The solar neighbourhood is an ideal testing ground for the study of debris discs and planetary systems. Proximity maximises dust mass sensitivity and can allow systems to be spatially resolved. Systems near the Sun span a wide range of stellar parameters e.g., mass, age, metallicity, multiplicity. Whilst determining these parameters may not be easy, the diversity included in volume limited samples makes them ideal for legacy surveys where one may wish to investigate trends as a function of many system parameters.

This paper presents five all-sky volume limited samples of nearby stellar systems with main-sequence primaries of spectral type A,F,G,K,M. These form the basis of the target lists of two complimentary surveys for debris discs using the SCUBA-2 (Submillimetre Common User Bolometer Array 2; Holland et al. 2003; Audley et al. 2004) camera on the James Clerk Maxwell Telescope (JCMT), and the Herschel space observatory (Pilbratt 2008).

The SCUBA-2 Unbiased Nearby Stars survey (SUNS; Matthews et al. 2007) is a large flux-limited survey of 500 systems at 850 μm. The target flux RMS is 0.7 mJy/beam, equal to the extragalactic confusion limit of the JCMT at 850 μm. Shallow 450 μm images of varying depth will be obtained simultaneously, and deep images at 450 μm will be proposed to follow-up 850 μm detections.

The Disc Emission via a Bias-free Reconnaissance in the Infrared/Sub-millimetre (DEBRIS) Herschel Open Time Key Program will image 446 systems (356 in common with SUNS) at 110 and 170 μm using the PACS (Photodetector Array Camera and Spectrometer; Poglitsch et al. 2008) instrument, with follow-up of around 100 systems at 250, 350 and 500 μm using the SPIRE (Spectral and Photometric Imaging Receiver; Griffin et al. 2008) instrument. This survey is primarily driven by the 110 μm band, which has the highest dust mass sensitivity for cold discs such as the Kuiper-Edgeworth belt of our Solar System. The intended flux RMS at 110 μm is 1.2 mJy/beam, which is twice the predicted extragalactic confusion limit. 170 μm images are taken simultaneously with a predicted RMS of 1.7 mJy/beam, equal to the predicted extragalactic confusion limit in this band.

The primary goals of these surveys are statistical: In general how do debris disc properties vary with stellar mass, age, metallicity, system morphology (multiplicity, component masses, separations), presence of planets etc. To be able to answer so many questions, and to minimise the risk of un-

© 2009 RAS

2 N. M. Phillips et al.

foreseen selection effects, large samples and simple, clearly defined target selection criteria are required. Volume limited samples satisfy these requirements, and as well as maximising the proximity of the targets, the stars nearest the Sun are very widely studied. For example, nearby stars are the main targets of radial velocity, astrometry and direct imaging planet searches. The majority of SUNS and DEBRIS targets also have photometry at 24 and 70 μm from the MIPS (Multiband Imaging Photometer and Spectrometer) instrument on the Spitzer space telescope, which ceased operation at the end of March 2009. This large spectral coverage, from 24 to 850 μm for over 300 systems will be an incredible resource for detailed spectral energy distribution modelling of systems with debris discs.

Given that we are considering the closest systems to the Sun, substantial effort was required to compile the samples presented here. Late M-type stars within 10 pc are still being discovered (e.g. Henry et al. 2006), and complete homogeneous datasets covering the spectral type and distance ranges we consider do not exist. We have tried to make our sample selection using the most complete and accurate data available at the time of the DEBRIS proposal submission in October 2007.

2 SELECTION CRITERIA

Our systems all have primaries (defined here as the component with the brightest visible magnitude) which we believe are main-sequence (i.e. hydrogen burning) stars. The sample is split into 5 volume limited subsamples based on spectral type: A, F, G, K, M. In the rest of this paper we use the term “X-type system” to mean “system with X-type primary”. Using separate subsamples is necessary due to the steep nature of the stellar mass function, which for example means that a single volume limited sample would contain over 100 times as many M-type systems as A-type systems. The choice of using spectral types to split the sample, rather than stellar mass, is purely practical as, with the exception of certain binary systems, stellar masses cannot be directly determined observationally. Using spectral types does however have the effect that the subsamples cover quite different ranges in logarithmic mass space.

The early type, upper mass, limit of A0 is chosen as stars of earlier type are too rare in the solar neighbourhood to build a suitably large sample. A conservative late type limit of M7.0 was chosen to avoid the inclusion of any brown dwarfs, and also to improve the completeness of the M-type sample. M-type stars span the largest log M range of any of our spectral classes, so making a cut at M7.0 will not restrict the statistical usefulness of the sample.

We do not discriminate against multiple star systems, and they are included naturally within the volume limits. We consider common proper motion stars (with compatible parallax where available) as members of the same system, with no specific limit on the binary separation. We have not gone so far as to consider stars with common space motion but large (≫1^∘) angular separation as systems. This definition of system membership was primarily chosen for convenience of target selection, but fits well with the statistical goals of these surveys. With the exception of stars in moving groups, each system can be considered to represent a different point

Figure 1. Johnson B,V absolute colour-magnitude diagram for system primaries. Overlaid are [Fe/H] = 0.0, [α/Fe] = 0.0 isochrones from the Dartmouth Stellar Evolution Database (Dotter et al. 2008) with ages of 0.25, 0.5, 1, 2, 4, 8 Gyr (with turn-offs going from left to right). The photometry is mostly converted from Tycho photometry (Tycho-2 or TDSC) using transformations for unreddened main-sequence stars. For most M-type targets Johnson B,V photometry from various sources was used (see text). Note that primaries in some close binaries are not individually resolved in this photometry.

in age and composition. The fact that several interesting objects (e.g. with known IR excess, or planets) are considered here as secondaries does not affect the statistical usefulness of the sample, although it has the disadvantage that such objects may not be observed by these surveys (see below).

The number of systems in each subsample was determined by the selection criteria for SUNS, which required 100 systems in each subsample in the declination range −40^∘ < δ < +80^∘. Hence the all-sky samples presented here contain roughly 123 (100×2/(sin 80^∘ +sin 40^∘)) systems each. The SUNS sample sizes were chosen to allow detection rates for various subsets e.g. planet hosts to be distinguished (see Matthews et al. 2007).

The DEBRIS target list comprises the nearest systems presented here (all-sky), subject to a cut in the predicted 110 μm cirrus confusion level towards each system. The confusion prediction was taken from the Herschel Confusion Noise Estimator (HCNE), which is part of the Herschel Observation Planning Tool (HSPOT). Systems with total predicted confusion for point-source detections greater than 1.2 mJy/beam, corresponding to twice the predicted extragalactic confusion limit, were rejected. To maximise the number of systems observed, DEBRIS will not image secondary components in systems where they will not fit in the PACS point-source field of view (FoV) (150^{′′} × 50^{′′} with unconstrained orientation) with the primary. This will affect between 20 and 49 systems depending on the actual field orientations.

The SUNS target list is simply the nearest 100 systems in each subsample here which have −40^∘ < δ < +80^∘ (with this sample it does not make any difference whether the cut is made in B1950 or J2000/ICRS equinox declination, but J2000/ICRS should be assumed). The large (∼ 600^{′′} ×600^{′′}) FoV of SCUBA-2 means that a maximum of 13 systems will have components not observed with the primary star.

Target selection for the SUNS/DEBRIS surveys 3

Table 1. Summary of subsample properties. d_{max} and N_{tot} are the maximum distance and number of stars in each subsample. ρ is the volume number density of systems, ρ = N_{tot}/d^3_{max} ± ρ/ √ N_{tot}. Med(T_{eff} ) is the median T_{eff} , and σ_{Teff} is the standard deviation of T_{eff} within each subsample. N_{planet} is the number of systems where one or more stars are listed as planet hosts in the exoplanet.eu database (27 July 2009). N_{debris} is the number of systems containing a currently detected debris disc (or other indistinguishable IR excess) as indicated by any of Rhee et al. (2007); Beichman et al. (2006); Su et al. (2006); Trilling et al. (2007). N_{SUNS} and N_{DEBRIS} are the numbers of systems from this paper included in the SUNS and DEBRIS surveys respectively.

Subsample d_{max} N_{tot} ρ Med(T_{eff} ) σ_{Teff} N_{planet} N_{debris} N_{SUNS} N_{DEBRIS} (pc) (pc^{−3}) (K) (K)

A 45.5 130 0.0014 ± 0.0001 8133 748 2 24 100 83 F 24.1 130 0.0093 ± 0.0008 6360 343 6 21 100 94 G 21.3 125 0.0129 ± 0.0012 5628 249 13 10 100 89 K 15.6 127 0.0335 ± 0.0030 4461 499 5 5 100 91 M 8.58 117 0.1855 ± 0.0171 3175 288 5 1 100 89

Total 629 31 61 500 446

Figure 2. Johnson B,V absolute colour-magnitude diagram for system primaries as in figure 1. Overlaid with zero age mainsequences (ZAMS) for stars from 0.2 M_⊙ upwards with [Fe/H] = +0.5, 0.0, −0.5, −1.0, −2.0 (from top to bottom). The ZAMS curves are produced from [α/Fe] = 0.0, Y = 0.245 + 1.6Z evolutionary tracks from the Dartmouth Stellar Evolution Database (Dotter et al. 2008), with values taken at 2% of the total lifetime of the stars.

Initially, it had been proposed to only include systems with primaries of spectroscopic luminosity classes V and IV- V. This criterion was retained for G, K and M classes, but was relaxed for A and F type stars, where there is not a simple relationship between luminosity class and evolutionary stage (e.g., Gray, Napier & Winkler 2001a; Gray, Graham & Hoyt 2001b). Candidates for the A and F samples (and other candidates without accurately known luminosity classes) were evaluated using their position on a Johnson B,V absolute colour-magnitude diagram. Figs 1 and 2 show such diagrams for the final sample overlaid with solar composition isochrones and zero age main sequences (ZAMS) for metallicities from +0.5 to −2.0. A certain amount of leeway had to be allowed for unknown metallicity, and uncertainties in photometry (e.g. unresolved secondaries in close binaries) and parallax.

3 SOURCES OF DATA

3.1 Parallaxes

Hipparcos-based parallaxes were taken from Hipparcos, the New Reduction of the Raw Data (HIPnr; van Leeuwen 2007) and several papers which applied special analysis to multiple systems (the General Notes issued with the original Hipparcos catalog (HIPgn, Perryman et al. 1997); Falin & Mignard 1999; Söderhjelm 1999; Fabricius & Makarov 2000). Parallaxes from HIPnr were used unless one of the other resources had a lower uncertainty. In cases where more than one of the other resources provided a parallax for the same Hipparcos system, we have have taken the parallax from the first resource in the order: Fabricius & Makarov (2000); Söderhjelm (1999); Falin & Mignard (1999); HIPgn. Hipparcos parallaxes from multiple resources for the same Hipparcos system were not averaged in any way to avoid underestimating the uncertainty in the averaged values, as they have all been reduced from the same data.

The other large parallax resource used was the 4th edition of the Yale General Catalog of Trigonometric Parallaxes (GCTP or YPC; van Altena et al. 1995), which contains approximately 2300 systems not measured by Hipparcos due to the magnitude limit of V ∼ 12 and the targeted nature of the Hipparcos astrometry mission.

In addition, for many M dwarfs, parallaxes from several smaller papers were used (e.g., Henry et al. 2006; Jao et al. 2005; Costa et al. 2005; Hershey & Taff 1998; Benedict el al. 1999; Weis et al. 1999; Ducourant et al. 1998), as well as some unpublished values from the RECONS consortium (Henry, private communication).

Where reliable parallaxes from multiple independent sources, or separate parallaxes for individual components in a system, are available, we take an uncertainty weighted average:

π_{adopted} = ∑ i πi/σ^2_i ∑ i 1/σ^2_i and σ_{adopted} = √ 1 ∑ i 1/σ^2_i

Two or more parallaxes were used for 81% of systems, and three or more were used for 7% of systems. These cases are mostly due to overlap with Hipparcos- and ground-based (e.g. YPC) parallaxes.

4 N. M. Phillips et al.

3.2 Spectral Types

For A-K type stars we have used spectral types from Gray et al. (2003, 2006) where they were available. Gray et al. have been obtaining spectra and determining spectral types and stellar parameters (T_{eff} , [M/H], log g) for stars considered to be within 25 pc and of spectral type earlier than M0 or with no spectral type in the Hipparcos catalogue (HIP; Perryman et al. 1997). For stars without published Gray et al. types we have used types from the Michigan Catalogue of HD stars (Houk et al. 1975, 1978, 1982, 1988, 1999), which includes all HD stars south of δB1900 = +05^∘. If types from neither Gray et al. or Houk et al. were available, we have fallen back on types in compilations such as the 5th revised edition of the Bright Star Catalogue (BSC5; Hoffleit 1991), HIP, or the 2nd edition of the Catalog of Components of Double & Multiple stars (CCDM; Dommanget & Nys 2002). These fall-back types are not considered to be accurate, and were largely ignored in the selection process in favour of photometry.

For ∼K5 and later stars we have generally used spectral types from the Palomar/MSU Nearby-Star Spectroscopic Survey (PMSU; Reid, Hawley & Gizis 1995; Hawley, Gizis & Reid 1996), which provides spectral types for almost all late-type stars in the 3rd Catalogue of Nearby stars (CNS3; Gliese & Jahreiss 1991). A large number of nearby M dwarfs also have measured spectral types in the system or Kirkpatrick, Henry & McCarthy (1991); however we have chosen to use PMSU types wherever possible for homogeneity. The difference between PMSU and Kirkpatrick et al. types is rarely more than one subtype. For newly discovered nearby M dwarfs not included in the PMSU, types in the Kirkpatrick et al. system (e.g. from Henry et al. 2006) have been adopted.

3.3 Photometry

Whilst distance and spectral type are our primary selection parameters, it was necessary to use photometry both for determining luminosity and when determining spectral class where only low accuracy spectral types were available. As distinguishing between dwarfs and giants for K/M type stars is very simple and because we had accurate spectral types for almost all candidates later than K5 (see above), photometry was only needed for the selection of systems on the G/K boundary and earlier. All of these candidates are bright enough to have sufficiently accurate photometry in the Tycho-2 catalogue (Høg et al. 2000), the Tycho Double Star Catalogue (TDSC; Fabricius et al. 2002), or the Tycho catalogue (Høg et al. 1997). Where there has been a need to convert between Tycho and Johnson photometry we have used the relationships in Høg et al. (2000).

3.4 Astrometry

Accurate positions and proper motions were necessary both for matching entries in the various catalogues used, and for finding common proper motion companions. Where possible, astrometry from Salim & Gould (2003); Gould & Chanamé (2004); Deacon et al. (2005); Subasavage et al. (2005a,b); Finch et al. (2007); Henry et al. (2006); Jao et al. (2005) have been used. For stars not included or not resolved in these, we have used astrometry from the TDSC; Tycho-2; the Tycho

Figure 3. Distribution of all systems in ICRS equatorial coordinates. The SUNS declination limits of +80^∘ and −40^∘, and the Galactic plane are shown.

Figure 4. Distribution in ICRS equatorial coordinates of the 446 systems in the DEBRIS survey. The cut in predicted cirrus confusion means that there are few systems near the Galactic plane.

Reference Catalogue (TRC; Høg et al. 1998); Tycho; Bakos, Sahu & Németh (2002); the Positions and Proper Motions catalogue (PPM; Röser & Bastian 1991, 1993; Röser et al. 1994); or the CCDM (in order of decreasing preference).

4 COMPONENTS OF MULTIPLE SYSTEMS

We have undertaken several steps to maximise the accuracy of the selection of components in multiple systems.

Using the database we have constructed for the purposes of the target selection, we have searched for stars with common proper motion to candidate targets. This not only yielded secondary stars which we had not previously identified, but also showed some candidates to be secondaries of other stars. In cases where common proper motion companions have independent parallax measurements, these have been checked to be compatible. Other common proper motion companions have been identified from literature, al-

Target selection for the SUNS/DEBRIS surveys 5

Table 2. Reference abbreviations used in the text and tables. CDS is Centre de Données astronomiques de Strasbourg. For HIPnr we have used the data on the CDROM published with the book, as it had not been added to the CDS at the time.

Abbreviation CDS catalogue(s) Reference

2MASS II/246 2MASS Point Source Catalogue (Cutri et al. 2003) BSC5 V/50 Bright Star Catalogue, 5th Revised Ed. (Hoffleit 1991) CCDM I/274 Catalogue of Components of Double & Multiple stars (Dommanget & Nys 2002) CNS3 V/70A Catalogue of Nearby Stars, Preliminary 3rd Version (Gliese & Jahreiss 1991) HIP I/239 Hipparcos Main Catalogue (Perryman et al. 1997) HIPgn I/239 Hipparcos General Notes (Perryman et al. 1997) HIPnr I/311* Hipparcos, the New Reduction of the Raw Data (van Leeuwen 2007) LHS I/279 Revised Luyten Half-Second catalogue (Bakos, Sahu & Németh 2002) NLTT J/ApJ/582/1011 Revised NLTT Catalog (Salim & Gould 2003) PPM I/{146, 193, 206, 208} Positions and Proper Motions catalogue (Röser & Bastian 1991, 1993; Röser et al. 1994) RECXX RECONS unpublished parallaxes (Henry, private communication) SCR J/AJ/{129/413, 130/1658, SuperCOSMOS-RECONS (Subasavage et al. 2005a,b; Finch et al. 2007) 133/2898} TDSC I/276 Tycho Double Star Catalogue (Fabricius et al. 2002) TRC I/250 Tycho Reference Catalogue (Høg et al. 1998) TYC I/239 Tycho catalogue (Høg et al. 1997) TYC2 I/259 Tycho-2 catalogue (Høg et al. 2000) YPC I/238A Yale Parallax Catalogue, 4th ed. (van Altena et al. 1995) WDS B/wds Washington Visual Double Star Catalog (Mason et al. 2009) ben99 Benedict el al. (1999) bes90 Bessel. (1990) cos05 Costa et al. (2005) dea05 J/A+A/435/363 Southern Infrared Proper Motion Survey (SIPS, Deacon et al. 2005) duc98 Ducourant et al. (1998) egg74 Eggen (1974) egg79 Eggen (1979) egg80 Eggen (1980) fab00 J/A+AS/144/45 Fabricius & Makarov (2000) fal99 J/A+AS/135/231 Falin & Mignard (1999) gou04 J/ApJS/150/455 Gould & Chanamé (2004) gray03 J/AJ/126/2048 Gray et al. (2003) gray06 J/AJ/132/161 Gray et al. (2006) jao05 Jao et al. (2005) hen06 Henry et al. (2006) haw95 III/198 Palomar/MSU survey (North) (Reid, Hawley & Gizis 1995) haw96 III/198 Palomar/MSU survey (South) (Hawley, Gizis & Reid 1996) houk III/{31B, 51B, 80, 133, 214} Michigan Catalogue of HD stars (Houk et al. 1975, 1978, 1982, 1988, 1999) her98 Hershey & Taff (1998) leg92 Legget (1992) rod74 Rodgers & Eggen (1974) sod99 J/A+A/341/121 Söderhjelm (1999) wei91 Weis (1991) wei96 Weis (1996) wei99 Weis et al. (1999)

though a systematic literature search for such companions has not been performed.

We have performed a complete check of all components listed in the CCDM as being in the CCDM systems of our targets. In many cases components listed in the CCDM are not physically associated (e.g. do not have common proper motion) with the target system. Many CCDM components have cross-identifications with other catalogues, so determining whether they have common proper motion is straightforward. For those without cross-identifications, or without accurate astrometry in other catalogues, only the astrometry in the CCDM could be used.

The process for determining system membership of CCDM components consisted of an automated search for components using the 2MASS Point Source Catalogue

(Cutri et al. 2003), and the Tycho/Tycho-2 catalogues, followed by manual inspection of 2MASS and Schmidt survey images, as well as comparison with the Washington Double Star catalogue (Mason et al. 2009) in many cases. CCDM components found not to be comoving with the target systems, or not identified at all, are not included in the sample presented here, but are listed in comments in table 8.

5 SAMPLE PROPERTIES

Overall properties of the subsamples are presented in table 1, including the numbers of systems containing stars with detected planets and debris discs. Figs 3 and 4 show the distribution of systems on the sky.

6 N. M. Phillips et al.

Figure 5. Number of included systems in each subsample as a function of distance (d_{max} = 8.58, 15.6, 21.3, 24.1, 45.5 pc for M,K,G,F,A). For comparison the line N = N(d_{max}) (_d dmax

)_{3 is}

shown. Note that the F,G,K subsamples fit well indicating no completeness trend with distance. The M subsample is likely incomplete beyond ∼ 6 pc.

Figure 6. Histogram of number of primaries in 500 K T_{eff} bins. Contributions from each spectral type subsample are shown in colour. For A-K stars T_{eff} was derived from (B_T −V_T) (or (B_J −V_J in a few cases where Tycho photometry was not available) using a polynomial fit against T_{eff} values from Gray et al. (2003, 2006) (see Fig. 7). (B_T −V_T) was used in preference to the more accurate temperature indicator (V − K_s), as components are resolved at very small separations in Tycho-2/TDSC photometry. For M-type stars T_{eff} was derived from our adopted spectral type using T_{eff} values from Reid & Hawley (2005).

Figure 7. Gray et al. (2003, 2006) T_{eff} vs. (B_T −V_T) for primary stars in our sample, with 4th order polynomial fit. This fit was used to generate T_{eff} values for all A-K primaries for Fig. 6. A point for a typical M0 type star at (1.70, 3800) was added to the fit to make it tie in with T_{eff} values for M type stars derived from spectral types using relationships in Reid & Hawley (2005).

5.1 Completeness

In Fig. 5, we show the number of systems as a function of distance for each of our subsamples. The F,G and K subsamples very closely follow a cubic law, indicating that we are justified to assume they are isotropically and homogeneously distributed in the relevant volumes and that we have no selection effects as a function of distance. For the M subsample there is almost certainly incompleteness at distances beyond ∼ 6 pc (see e.g. Henry, Kirkpatrick & Simons 1994) which will mostly affect the latest type stars. The deviation of the A subsample from the cubic law is likely a combination

Target selection for the SUNS/DEBRIS surveys 7

of a slight lack of systems towards the Galactic poles at the largest distances, and correlation between system positions due to the young age of A stars.

5.2 Temperature Distribution

As our sample was split into subsamples based on spectral class, we expected to have a good coverage of effective temperature of primary stars from about 2500 to 10000 K (M7- A0 types). Fig. 6 shows the distribution of T_{eff} for primary stars in our sample in 500 K bins. The colours in the plot indicate the contributions from the five A-M subsamples. For A-K stars, T_{eff} was computed from (BT − VT) using a fit to T_{eff} for stars in our sample from Gray et al. (2003, 2006). (BT − VT) was chosen as opposed to other photometric colours such as (BJ − VJ) or (VT − Ks), as accurate homogeneous BT and VT photometry that is resolved down to separations of < 0.5^{′′} is available for almost all of our A-K primaries from the Tycho-2 and Tycho Double Star (TDSC) catalogues. The fit of (BT − VT) to Gray et al.’s T_{eff} values is show in Fig. 7. A fourth order least-squares polynomial fit was obtained:

T_{eff} /K = (9646.15 ± 37.6) −(10018.4 ± 354.4)(BT − VT) +(9056.19 ± 963.2)(BT − VT)^2 −(4424.10 ± 950.5)(BT − VT)^3 +(807.378 ± 302.8)(BT − VT)^4

This agrees well with the fit of Ramírez & Meléndez (2005) with [Fe/H] = 0.0 for their range of validity of 0.344 < (BT − VT) < 1.715. Our RMS of residuals is 150.7 K for 302 stars, which is higher than that of Ramírez & Meléndez (2005) (104 K for 378 stars), as we cover a larger temperature range, have not used [Fe/H] as a fit parameter, and have not accounted for interstellar reddening (although this should be almost negligible for our nearby star sample).

For M-type stars we determined T_{eff} simply from our adopted spectral type using values from Reid & Hawley (2005). The above photometric fit for A-K stars included a point representative of a typical M0 type star at (BT −VT) = 1.70, T_{eff} = 3800 K to make the fit consistent with our M star temperatures at the K/M boundary.

The peak in the T_{eff} distribution at about 5700 K is due to the G and F spectral types covering a narrow range in T_{eff} . Indeed, in retrospect, there would be justification for treating F and G types as a single spectral type sample.

6 CATALOGUE

Table 2 lists the reference abbreviations used throughout this paper and in the other tables. Tables 3-6 define the sample, and give information used in the selection process. Each system is given an identifier of the form XNNN where X is the spectral class (subsample) and NNN is a zero-padded running number increasing with distance in each subsample. These identifiers are referred to by the acronym UNS, standing for Unbiased Nearby Stars, as in the SUNS survey name.

The choice of name for components is generally in order of preference: HD, HIP, GJ, LHS, NLTT, TYC, PPM, CCDM, other catalogue name, 2MASS. For systems with multiple stars, the first identifier in that order which uniquely identifies the component is used. Where components are not resolved in any catalogues we have used, we just give a single entry and a comment in table 8.

Table 3 lists system properties, including the name of the primary star, our adopted distance, and whether the system is included in the SUNS and DEBRIS surveys.

Table 4 lists the components of systems which are resolved in at least one of the catalogues we have used, and gives positions and proper motions, as well as approximate separation from the primary where this is larger than 1^{′′}. Where two references are listed for a component, the proper motion has been copied from another component in the system, and in several cases the position is computed using a relative position from the CCDM combined with the position of another component.

Tables 5 and 6 list the properties of primary stars in systems, which were used for selection in spectral type and luminosity (spectral type, photometry), and/or in the plots in this paper (photometry, effective temperatures). Table 5 contains the A-K type primaries with Tycho photometry, and effective temperatures from Gray et al. (2003, 2006) and computed from (BT − VT). For the few very bright stars where Tycho photometry is saturated, we give values converted from Johnson B, V photometry. Table 6 contains the M type primaries with spectral types, Johnson B, V photometry, and effective temperatures computed from the spectral type.

Table 7 gives cross identifications for system components in several common catalogues, and table 8 gives comments on various specific systems. Table 8 includes notes for systems where there are unresolved components, or there are components listed in catalogues which we do not consider physically associated with the system.

7 ACKNOWLEDGEMENTS

This research has made use of the SIMBAD and VIZIER databases, operated at CDS, Strasbourg, France. We have made extensive use of the open source MySQL relational database management system. The authors wish to thank Todd Henry for providing unpublished RECONS parallaxes, which helped to refine our selection of M type systems.

REFERENCES

Audley M.D., Holland W.S., Hodson T. et al., 2004, Proc. SPIE, 5498, 63 Bakos G.Á, Sahu K.C., Németh P., 2002, ApJS, 141, 187 Beichman C.A., Bryden G., Stapelfeldt, K.R. et al., 2006, ApJ, 652, 1674 Benedict G.F., McArthur B., Chappell D.W. et al., 1999, AJ, 118, 1086 Bessel M.S., 1990, AJ, 112, 2300 Costa E., Méndez R.A., Jao W.-C., Henry T.J., Subasavage J.P., Brown M.A., Ianna P.A., Bartlett J.L., 2005, AJ, 130, 337

8 N. M. Phillips et al.

Cutri R.M., Skrutskie M.F., van Dyk S. et al., 2MASS All Sky Catalog of point sources, NASA/IPAC Infrared Science Archive Deacon N.R., Hambly N.C., Cooke J.A., 2005, A&A, 435, 363 Delfosse X., Forveille T., Udry S., Beuzit J.-L., Mayor M., Perrier C., 1999, A&A, 350L, 39 Dommanget J., Nys O., 2002, CDS catalogue I/274 Dotter A., Chaboyer B., Jevremović, D., Kostov, V., Baron, E., Ferguson, J.W., 2008, ApJS, 178, 89 Ducourant C., Dauphole B., Rapaport M., Colin J., Geffert, M., 1998, A&A, 333, 882 Eggen O.J., 1974, PASP, 86, 697 Eggen O.J., 1979, ApJS, 39, 89 Eggen O.J., 1980, ApJS, 43, 457 Fabricius C., Makarov V.V., 2000, A&AS, 144, 45 Fabricius C., Høg E., Makarov, V.V., Mason B.D., Wycof, G.L., Urban S.E., 2002, A&A, 384, 180 Falin J.L., Mignard F., 1999, A&AS, 135, 231 Finch C.T., Henry T.J., Subasavage J.P., Jao W.-C, Hambly N.C., 2007, AJ, 133, 2898 Gliese W., Jahreiss H., 1991 CDS catalogue V/70A Gould A., Chanamé J.A., 2004, ApJS, 152, 103 Gray R.O., Napier M.G., Winkler L.I., 2001a, AJ, 121, 2148 Gray R.O., Graham P.W., Hoyt S.R., 2001b, AJ, 121, 2159 Gray R.O., Corbally C.J., Garrison R.F., Mcfadden M.T., Robinson P.E., 2003, AJ, 126, 2048 Gray R.O., Corbally C.J., Garrison R.F., McFadden M.T., Bubar E.J., McGahee C.E., O’Donoghue A.A., Knox E.R., 2006, AJ, 132, 161 Griffin M., Swinyard B., Vigroux L. et al., 2008, Proc. SPIE, 7010, 701006 Hawley S.L., Gizis J.E., Reid, I.N., 1996 AJ, 112, 1799 Heintz W.D., 1980 ApJS, 44, 111 Heintz W.D., 1990 ApJS, 74, 275 Henry T.J., Kirkpatrick J.D., Simons D.A., 1994, AJ, 108, 1437 Henry T.J., Jao W.-C., Subasavage J.P., Beaulieu T.D., Ianna P.A., Costa E., 2006, AJ, 132, 2360 Hershey J.L., Taff, L.G., 1998 AJ, 116, 1440 Hoffleit D., Warren Jr W.H., 1991, CDS catalogue V/50 Høg, E., Bässgen, G., Bastian U. et al., 1997, A&A, 323, L57 Høg, E., Kuzmin A., Bastian U., Fabricius C., Kuimov K., Lindegren L., Makarov V.V., Roeser, S., 1998, A&A, 335, L65 Høg, E., Fabricius C., Makarov V.V. et al., 2000, A&A, 355, L27 Holland W.S., Duncan W.D., Kelly B.D., Irwin K.D., Walton A.J., Ade P.A.R., Robson E.I. et al., 2003, Proc. SPIE, 4855, 1 Houk N., Cowley A.P., 1975, Michigan Catalogue of Twodimensional Spectral Types for the HD stars. Volume 1. Declinations -90^∘.0 to -53^∘.0, Department of Astronomy, University of Michigan, Ann Arbor, MI, USA Houk N., 1978, Michigan Catalogue of Two-dimensional Spectral Types for the HD Stars. Volume 2. Declinations -53^∘.0 to -40^∘.0, Department of Astronomy, University of Michigan, Ann Arbor, MI, USA Houk N., 1982, Michigan Catalogue of Two-dimensional Spectral Types for the HD Stars. Volume 3. Declinations -40^∘.0 to -26^∘.0, Department of Astronomy, University of

Michigan, Ann Arbor, MI, USA Houk N., Smith-Moore M., 1988, Michigan Catalogue of Two-dimensional Spectral Types for the HD Stars. Volume 4. Declinations -26^∘.0 to -12^∘.0, Department of Astronomy, University of Michigan, Ann Arbor, MI, USA Houk N., Swift C., 1999, Michigan Catalogue of Twodimensional Spectral Types for the HD Stars. Volume 4. Declinations -12^∘.0 to +05^∘.0, Department of Astronomy, University of Michigan, Ann Arbor, MI, USA Jao, W.-C., Henry T.J., Subasavage J.P., Brown M.A., Ianna P.A., Bartlett J.L., Costa E., Méndez R.A., 2005, AJ, 129, 1954 Kirkpatrick J.D., Henry T.J., McCarthy D.W. Jr., 1991, AJ, 77, 417 Legget S.K., 1992, ApJS, 82, 351 Leinert C., Allard F., Richichi A., Hauschildt P.H., 2000, A&A, 353, 691 Matthews B.C., Greaves J.S., Holland W.S. et al., 2007, PASP, 119, 842 McAlister H.A., Hartkopf W.I., Hutter D.J., Franz O.G., 1987, AJ, 93, 688 Perryman M.A.C., Lindegren L., Kovalevsky J. et al., 1997, A&A, 323L, 49 Pilbratt G., 2008, Proc. SPIE, 7010, 701002 Poglitsch A., Waelkens C., Bauer O.H. et al., 2008, Proc. SPIE, 7010, 701005 Ramírez I., Meléndez J., 2005, ApJ, 626, 465 Reid I.N., Hawley S.L., Gizis J.E., 1995, AJ, 110, 1838 Reid I.N., Hawley S.L., 2005, New Light on Dark Stars, Springer-Praxis books, New York Rhee J.H., Song I., Zuckerman B., McElwain, M., 2007, ApJ, 660, 1556 Rodgers A.W., Eggen O.J., 1974, PASP, 86, 742 Röser S., Bastian U., 1991, PPM Star Catalogue North, Spektrum Akademischer Verlag, Heidelberg (Germany) Röser S., Bastian U., 1993, PPM Star Catalogue South, Spektrum Akademischer Verlag, Heidelberg (Germany) Röser S., Bastian U., Kuzmin, A., 1994, A&AS, 105, 301 Salim S., Gould A., 2003, ApJ, 582, 1011 Söderhjelm S., 1999, A&A, 341, 121 Su K.Y.L., Rieke G.H., Stansberry J.A. et al. 2006, ApJ, 653, 675 Subasavage J.P., Henry T.J., Hambly N.C., Brown M.A., Jao W.-C, 2005a, AJ, 129, 413 Subasavage J.P., Henry T.J., Hambly N.C., Brown M.A., Jao W.-C, Finch, C.T., 2005b, AJ, 130, 1658 van Altena W.F. Lee J.T., Hoffleit E.D., 1995, General Catalogue of Trigonometric Stellar Parallaxes, 4th ed., New Haven, CT : Yale University Observatory Trilling D.E., Bryden G., Beichman C.A. et al., 2008, ApJ, 674, 1086 van Leeuwen F., 2007, Hipparcos, the New Reduction of the Raw Data, Springer / Astrophysics and Space Science Library Mason B.D., Wycoff G.L., Hartkopf W.I., Douglass G.G., Worley C.E., The Washington Visual Double Star Catalog, VizieR On-line Data Catalog Weis E.W., 1991, AJ, 102, 1795 Weis E.W., 1996, AJ, 112, 2300 Weis, E.W., Lee J.T., Lee A.H., Greise III J.W., Vincent J.M., Upgren A.R., 1999, AJ, 117, 1037

Target selection for the SUNS/DEBRIS surveys 9

Table 3. System information: system ID, primary star name, adopted distance and uncertainty (d = 1/π ± σ_π /π^2), number of parallax measures used, parallax references (see table 2), predicted cirrus confusion noise for point source observed with Herschel’s PACS instrument at 110 μm, which surveys system is included in (S: SUNS, D: DEBRIS). Note that distance uncertainty is not shown for the 2 systems with unpublished RECONS parallaxes. The distance for UNS G001 (α + Proxima Centauri) does not include any contribution from Proxima, as the parallax difference from the primary is significant.

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

M001 HIP 87937 1.833 ± 0.001 2 YPC,HIPnr,ben99 1.29 S M002 GJ 406 2.386 ± 0.012 1 YPC 0.53 S D M003 HD 95735 2.543 ± 0.004 2 HIPnr,YPC 0.52 S D M004 GJ 65 A 2.676 ± 0.019 1 YPC 0.52 S D M005 HIP 92403 2.965 ± 0.017 2 HIPnr,YPC 6.07 S M006 GJ 905 3.165 ± 0.011 1 YPC 0.78 S D M007 HD 217987 3.278 ± 0.007 2 YPC,HIPnr 0.52 S D M008 HIP 57548 3.354 ± 0.015 2 YPC,HIPnr 0.53 S D M009 GJ 866 AB 3.454 ± 0.052 1 YPC 0.55 S D M010 HD 173739 3.524 ± 0.018 3 HIPnr,YPC,HIPnr 0.54 S D M011 HD 1326 3.583 ± 0.009 2 HIPnr,YPC 0.61 S D M012 GJ 1111 3.626 ± 0.039 1 YPC 0.54 S D M013 LHS 1565 3.678 ± 0.018 1 hen06 0.52 D M014 HIP 5643 3.716 ± 0.041 2 YPC,HIPnr 0.52 S D M015 HIP 36208 3.795 ± 0.018 2 YPC,HIPnr 0.60 S D M016 SO 0253+1652 3.837 ± 0.040 1 hen06 1.53 S M017 HD 33793 3.911 ± 0.014 2 YPC,HIPnr 0.53 D M018 HD 239960 4.031 ± 0.023 2 sod99,YPC 49.24 S M019 GJ 234 A 4.093 ± 0.034 2 YPC,sod99 8.42 S M020 HIP 80824 4.267 ± 0.027 2 YPC,HIPnr 3.81 S M021 HD 225213 4.342 ± 0.017 2 YPC,HIPnr 0.52 S D M022 GJ 473 A 4.388 ± 0.089 1 YPC 0.52 S D M023 GJ 83.1 4.448 ± 0.057 1 YPC 0.58 S D M024 HIP 86162 4.536 ± 0.017 2 HIPnr,YPC 0.55 S D M025 GJ 3622 4.539 ± 0.074 1 YPC 0.53 S D M026 HIP 85523 4.543 ± 0.029 2 HIPnr,YPC 5.30 M027 GJ 1245 A 4.541 ± 0.021 1 YPC 3.25 S M028 HIP 113020 4.693 ± 0.043 2 HIPnr,YPC 0.54 S D M029 GJ 1002 4.695 ± 0.079 1 YPC 0.53 S D M030 GJ 3618 4.769 ± 0.060 2 YPC,hen06 8.28 M031 HIP 54211 4.862 ± 0.022 2 YPC,HIPnr 0.52 S D M032 GJ 388 4.888 ± 0.067 1 YPC 0.52 S D M033 HD 204961 4.949 ± 0.025 2 YPC,HIPnr 0.52 D M034 HIP 86214 5.048 ± 0.052 2 HIPnr,YPC 5.33 M035 HIP 112460 5.098 ± 0.039 2 YPC,HIPnr 2.13 S M036 GJ 1116 A 5.230 ± 0.068 1 YPC 0.53 S D M037 GJ 3379 5.259 ± 0.051 2 YPC,hen06 8.85 S M038 GJ 3323 5.321 ± 0.036 1 hen06 0.56 S D M039 HIP 57544 5.340 ± 0.047 2 HIPnr,YPC 0.56 S D M040 HD 119850 5.395 ± 0.030 2 HIPnr,YPC 0.53 S D M041 GJ 169.1 A 5.539 ± 0.024 2 HIPnr,YPC 6.87 S M042 HD 265866 5.614 ± 0.045 2 HIPnr,YPC 0.77 S D M043 HD 36395 5.682 ± 0.034 2 HIPnr,YPC 5.53 S M044 HIP 103039 5.711 ± 0.110 1 HIPnr 0.57 S D M045 HD 42581 5.754 ± 0.032 2 YPC,HIPnr 0.59 S D M046 HIP 86990 5.844 ± 0.076 2 YPC,HIPnr 0.96 D M047 HD 180617 5.851 ± 0.020 2 HIPnr,YPC 17.13 S M048 HIP 26857 5.898 ± 0.109 2 YPC,HIPnr 3.75 S M049 LHS 60 5.916 ± 0.054 1 jao05 0.65 D M050 HIP 76074 5.934 ± 0.045 2 YPC,HIPnr 1.14 D M051 CCDM 00155-1608 A 5.950 ± 0.029 3 YPC,sod99,her98 0.53 S D M052 HIP 117473 5.952 ± 0.041 2 YPC,HIPnr 0.53 S D M053 HIP 37766 5.982 ± 0.073 2 HIPnr,YPC 0.54 S D M054 HIP 34603 6.119 ± 0.067 2 YPC,HIPnr 0.56 S D M055 HIP 71253 6.220 ± 0.077 3 YPC,HIPnr,jao05 0.63 S D M056 HIP 74995 6.338 ± 0.071 3 YPC,HIPnr,jao05 0.69 S D M057 GJ 896 A 6.256 ± 0.060 3 YPC,HIPnr,wei99 0.62 S D M058 LHS 2090 6.375 ± 0.108 1 hen06 0.53 S D Continued on next page...

10 N. M. Phillips et al.

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

M059 GJ 3737 6.378 ± 0.081 1 hen06 0.59 S D M060 GJ 661 A 6.397 ± 0.052 2 sod99,YPC 0.53 S D M061 GJ 3959 6.410 ± 0.164 1 duc98 0.52 S D M062 GJ 644 A 6.457 ± 0.023 4 YPC,sod99,HIPnr,YPC 4.40 S M063 HIP 80459 6.530 ± 0.039 2 YPC,HIPnr 0.52 S D M064 LHS 271 6.534 ± 0.103 1 jao05 1.43 M065 GJ 1156 6.540 ± 0.128 1 YPC 0.53 S D M066 GJ 3877 6.558 ± 0.087 2 YPC,cos05 0.97 S D M067 HIP 53767 6.697 ± 0.071 2 HIPnr,YPC 0.52 S D M068 HIP 106106 6.711 ± 0.076 2 HIPnr,YPC 0.68 S D M069 GJ 3522 6.772 ± 0.091 1 hen06 0.56 S D M070 HIP 53020 6.794 ± 0.137 2 HIPnr,YPC 0.53 S D M071 HD 216899 6.831 ± 0.045 2 HIPnr,YPC 0.58 S D M072 GJ 299 6.835 ± 0.145 1 YPC 0.52 S D M073 GJ 3193 B 6.912 ± 0.120 2 hen06,hen06 0.54 S D M074 LHS 22 6.973 ± 0.093 1 jao05 0.52 D M075 HD 199305 7.061 ± 0.031 2 YPC,HIPnr 5.70 S M076 HIP 51317 7.129 ± 0.103 2 HIPnr,YPC 0.57 S D M077 GJ 4063 7.200 ± 2.088 1 haw95 0.63 S D M078 GJ 1286 7.231 ± 0.183 1 YPC 0.54 S D M079 GJ 4053 7.273 ± 0.280 1 YPC 0.54 S D M080 NLTT 54872 7.412 ± 1 RECXX 0.52 S D M081 GJ 4274 7.440 ± 0.271 1 YPC 0.53 S D M082 GJ 4248 7.447 ± 0.073 1 hen06 0.52 S D M083 HIP 83945 7.473 ± 0.091 2 YPC,HIPnr 0.52 S D M084 GJ 1224 7.541 ± 0.210 1 YPC 41.29 S M085 GJ 3378 7.570 ± 0.281 1 YPC 0.77 S D M086 HIP 12781 7.585 ± 0.114 2 HIPnr,YPC 1.54 S M087 HIP 65859 7.593 ± 0.057 2 HIPnr,YPC 0.53 S D M088 GJ 3207 7.700 ± 1.155 1 haw96 0.52 S D M089 GJ 2005 7.710 ± 0.144 2 YPC,cos05 0.52 S D M090 GJ 1093 7.764 ± 0.211 1 YPC 0.57 S D M091 HD 165222 7.769 ± 0.082 2 YPC,HIPnr 37.53 S M092 HIP 61874 7.780 ± 0.236 1 HIPnr 0.74 D M093 HIP 5496 7.798 ± 0.117 3 YPC,HIPnr,hen06 0.52 D M094 GJ 831 A 7.800 ± 0.125 2 HIPgn,YPC 0.53 S D M095 HIP 49986 7.930 ± 0.114 2 YPC,HIPnr 0.53 S D M096 LHS 1989 7.962 ± 0.061 1 hen06 0.99 S D M097 HIP 101180 8.024 ± 0.066 2 YPC,HIPnr 4.17 S M098 HIP 80346 8.033 ± 0.073 2 HIPnr,YPC 0.52 S D M099 GJ 257 A 8.034 ± 0.135 2 HIPnr,YPC 0.67 D M100 HIP 86287 8.050 ± 0.097 2 HIPnr,YPC 0.57 S D M101 GJ 1289 8.097 ± 0.190 1 YPC 0.70 S D M102 SCR 0740-4257 8.109 ± 1 RECXX 8.96 M103 GJ 493.1 8.123 ± 0.231 1 YPC 0.53 S D M104 GJ 747 A 8.177 ± 0.167 1 YPC 0.76 S D M105 SCR 1138-7721 8.179 ± 0.195 1 hen06 2.19 M106 GJ 1151 8.190 ± 0.195 1 YPC 0.52 S D M107 GJ 1227 8.230 ± 0.149 1 YPC 0.55 S D M108 HIP 4856 8.260 ± 0.082 2 YPC,HIPnr 4.30 S M109 HIP 38956 8.269 ± 0.159 2 YPC,HIPnr 0.54 S D M110 GJ 1230 A 8.271 ± 0.493 1 YPC 1.00 S D M111 GJ 618 A 8.301 ± 0.168 2 HIPnr,YPC 32.97 S M112 HIP 62452 8.358 ± 0.185 2 HIPnr,YPC 0.52 S D M113 GJ 232 8.375 ± 0.161 1 YPC 8.03 S M114 GJ 1154 AB 8.375 ± 0.246 1 YPC 0.53 S D M115 GJ 3146 8.496 ± 0.289 1 YPC 0.80 S D M116 GJ 1057 8.540 ± 0.255 1 YPC 1.09 S D M117 GJ 3454 8.576 ± 0.071 1 hen06 0.54 D

K001 HD 22049 3.216 ± 0.002 2 HIPnr,YPC 0.53 S K002 HD 201091 3.495 ± 0.006 3 HIPnr,HIPnr,YPC 4.12 S Continued on next page...

Target selection for the SUNS/DEBRIS surveys 11

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

K003 HD 209100 3.622 ± 0.004 2 HIPnr,YPC 0.52 D K004 HD 202560 3.946 ± 0.012 2 HIPnr,YPC 0.55 S D K005 HD 88230 4.866 ± 0.012 2 HIPnr,YPC 0.52 S D K006 HD 26965 4.984 ± 0.006 2 HIPnr,YPC 0.70 S D K007 HD 165341 5.080 ± 0.021 2 HIPnr,YPC 1.75 S K008 HD 131977 5.861 ± 0.023 3 sod99,HIPnr,YPC 0.78 S D K009 HD 155886 5.949 ± 0.014 4 YPC,HIPnr,YPC,HIPnr 14.83 S K010 HD 191408 6.015 ± 0.010 2 YPC,HIPnr 0.63 S D K011 HD 79210 6.108 ± 0.094 3 HIPnr,YPC,HIPnr 0.52 S D K012 HD 191849 6.198 ± 0.038 2 HIPnr,YPC 0.53 D K013 HD 219134 6.542 ± 0.012 2 YPC,HIPnr 17.42 S K014 HD 16160 7.191 ± 0.023 2 YPC,HIPnr 0.83 S D K015 HD 156384 7.246 ± 0.031 2 YPC,fab00 77.15 S K016 HD 4628 7.449 ± 0.027 2 HIPnr,YPC 0.52 S D K017 HD 10476 7.533 ± 0.028 2 YPC,HIPnr 0.57 S D K018 HD 6582 7.537 ± 0.042 2 YPC,HIPnr 3.98 S K019 HD 216803 7.611 ± 0.036 2 YPC,HIPnr 0.52 S D K020 HD 10361 7.674 ± 0.128 2 YPC,HIPnr 0.53 D K021 HD 157881 7.700 ± 0.042 2 HIPnr,YPC 1.11 S D K022 HD 217357 8.214 ± 0.046 2 YPC,HIPnr 0.53 S D K023 HD 32450 8.551 ± 0.109 2 YPC,HIPnr 0.53 S D K024 HD 32147 8.713 ± 0.036 2 YPC,HIPnr 0.61 S D K025 HD 50281 8.722 ± 0.033 2 YPC,HIPnr 23.14 S K026 HD 156274 8.790 ± 0.053 2 HIPnr,YPC 6.60 K027 HD 192310 8.910 ± 0.024 2 YPC,HIPnr 0.63 S D K028 HD 103095 9.081 ± 0.033 2 YPC,HIPnr 0.52 S D K029 HD 100623 9.559 ± 0.034 2 YPC,HIPnr 0.56 S D K030 HD 149661 9.757 ± 0.039 2 YPC,HIPnr 1.67 S K031 HD 151288 9.809 ± 0.067 2 HIPnr,YPC 0.53 S D K032 HD 122064 10.063 ± 0.032 1 HIPnr 0.52 S D K033 HD 232979 10.118 ± 0.100 2 YPC,HIPnr 19.88 S K034 HD 103932 10.156 ± 0.060 2 YPC,HIPnr 0.61 S D K035 HD 17925 10.341 ± 0.042 2 YPC,HIPnr 0.53 S D K036 HD 111631 10.605 ± 0.091 2 HIPnr,YPC 0.52 S D K037 HD 154363 10.627 ± 0.091 4 YPC,HIPnr,HIPgn,YPC 4.74 S K038 HD 13445 10.782 ± 0.037 2 YPC,HIPnr 0.52 D K039 HD 147379 10.798 ± 0.089 3 HIPnr,YPC,HIPnr 0.53 S D K040 HD 223778 10.887 ± 0.035 2 HIPnr,YPC 4.68 S K041 HIP 66459 10.935 ± 0.135 2 HIPnr,YPC 0.52 S D K042 HD 160346 11.008 ± 0.082 2 YPC,HIPnr 1.60 S K043 HD 11507 11.017 ± 0.140 2 YPC,HIPnr 0.52 S D K044 HD 166620 11.025 ± 0.036 2 HIPnr,YPC 0.53 S D K045 HD 3651 11.056 ± 0.039 2 HIPnr,YPC 0.53 S D K046 HD 115404 11.095 ± 0.090 2 HIPnr,YPC 0.52 S D K047 HD 74576 11.140 ± 0.046 2 YPC,HIPnr 12.10 S K048 HD 85512 11.150 ± 0.083 2 YPC,HIPnr 1.75 K049 HD 75632 11.275 ± 0.344 2 HIPgn,YPC 0.53 S D K050 GJ 4 A 11.288 ± 0.122 3 HIPnr,HIPnr,YPC 0.72 S D K051 HD 245409 11.290 ± 0.126 2 HIPnr,YPC 2.68 S K052 HD 222237 11.408 ± 0.066 2 HIPnr,YPC 0.53 D K053 HD 131511 11.512 ± 0.061 2 HIPnr,YPC 0.53 S D K054 HD 125072 11.788 ± 0.096 2 HIPnr,YPC 63.92 K055 CCDM 15009+4526 A 11.881 ± 0.147 2 HIPnr,YPC 0.52 S D K056 HD 97101 11.961 ± 0.120 2 HIPnr,YPC 0.52 S D K057 HD 196877 12.151 ± 0.157 2 HIPnr,YPC 0.53 D K058 HD 37394 12.273 ± 0.076 4 HIPnr,YPC,HIPnr,YPC 3.59 S K059 HD 101581 12.400 ± 0.107 2 HIPnr,YPC 0.71 D K060 HD 75732 12.460 ± 0.104 2 HIPnr,YPC 0.53 S D K061 HD 21531 12.509 ± 0.152 2 HIPnr,YPC 0.53 S D K062 HD 158633 12.803 ± 0.049 2 HIPnr,YPC 0.53 S D K063 HD 190007 12.864 ± 0.088 2 HIPnr,YPC 0.92 S D K064 HD 82106 12.894 ± 0.106 2 HIPnr,YPC 0.56 S D Continued on next page...

12 N. M. Phillips et al.

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

K065 HD 40307 12.995 ± 0.062 1 HIPnr 0.56 D K066 HD 36003 13.041 ± 0.128 2 HIPnr,YPC 3.91 S K067 HD 27274 13.045 ± 0.082 2 YPC,HIPnr 0.52 D K068 HD 166348 13.127 ± 0.180 2 YPC,HIPnr 0.96 D K069 HD 98712 13.169 ± 0.216 2 YPC,HIPnr 0.58 S D K070 HIP 67090 13.193 ± 0.169 2 YPC,HIPnr 0.52 S D K071 HD 29697 13.200 ± 0.193 2 HIPnr,YPC 5.44 S K072 HD 128165 13.215 ± 0.073 2 YPC,HIPnr 0.52 S D K073 HD 170657 13.248 ± 0.122 2 YPC,HIPnr 11.77 S K074 HD 120476 13.373 ± 0.136 2 YPC,HIPnr 0.52 S D K075 GJ 428 A 13.423 ± 0.434 2 YPC,HIPnr 99.94 K076 HD 211970 13.532 ± 0.222 1 HIPnr 0.52 D K077 HD 214749 13.551 ± 0.141 2 HIPnr,YPC 0.52 S D K078 HD 10436 13.575 ± 0.175 2 YPC,HIPnr 25.89 S K079 HD 22496 13.589 ± 0.131 2 YPC,HIPnr 0.52 D K080 HD 154577 13.629 ± 0.130 2 YPC,HIPnr 1.16 D K081 HIP 61094 13.679 ± 0.239 2 HIPnr,YPC 0.52 S D K082 HIP 27188 13.716 ± 0.176 2 YPC,HIPnr 1.13 S D K083 HIP 42220 13.886 ± 0.231 2 YPC,HIPnr 0.53 S D K084 HD 145417 13.897 ± 0.131 2 YPC,HIPnr 4.98 K085 HD 184489 13.905 ± 0.271 2 YPC,HIPnr 2.75 S K086 GJ 400 A 13.900 ± 0.316 2 HIPnr,YPC 0.52 S D K087 HD 23356 13.953 ± 0.130 1 HIPnr 0.58 S D K088 HD 216133 14.133 ± 0.363 2 YPC,HIPnr 0.54 S D K089 HD 5133 14.163 ± 0.120 2 YPC,HIPnr 0.52 S D K090 HD 61606 14.191 ± 0.119 3 HIPnr,YPC,HIPnr 0.77 S D K091 HD 234078 14.194 ± 0.160 2 HIPnr,YPC 0.52 S D K092 HD 110315 14.194 ± 0.146 2 HIPnr,YPC 0.53 S D K093 HD 173818 14.244 ± 0.233 2 YPC,HIPnr 273.87 S K094 HD 150689 14.263 ± 0.134 2 HIPnr,fab00 12.10 S K095 HD 120467 14.286 ± 0.177 2 YPC,HIPnr 0.59 S D K096 HIP 70218 14.393 ± 0.169 2 YPC,HIPnr 0.52 S D K097 HIP 44722 14.474 ± 0.260 2 YPC,HIPnr 0.55 S D K098 HD 144579 14.508 ± 0.069 3 YPC,YPC,HIPnr 0.52 S D K099 HIP 37288 14.533 ± 0.292 2 HIPnr,YPC 0.60 S D K100 HD 57095 14.585 ± 0.119 2 HIPnr,YPC 1.25 K101 HD 205390 14.618 ± 0.124 2 HIPnr,YPC 0.53 D K102 HD 97584 14.631 ± 0.139 2 HIPnr,YPC 0.56 S D K103 HD 120036 14.633 ± 0.289 1 HIPnr 0.55 S D K104 HD 52698 14.650 ± 0.131 2 YPC,HIPnr 3.50 S K105 HD 144628 14.669 ± 0.138 2 YPC,HIPnr 8.63 K106 HD 142709 14.742 ± 0.169 2 YPC,HIPnr 14.09 K107 HD 19305 14.747 ± 0.389 2 YPC,HIPnr 0.63 S D K108 HIP 13375 14.757 ± 0.299 2 YPC,HIPnr 0.70 S D K109 HD 118926 14.763 ± 0.253 2 YPC,HIPnr 0.53 S D K110 HD 45088 14.763 ± 0.316 2 YPC,HIPnr 5.21 S K111 HD 110833 14.889 ± 0.146 2 YPC,HIPnr 0.52 S D K112 HD 221503 14.902 ± 0.383 3 fab00,YPC,HIPnr 0.52 S D K113 HIP 5247 14.938 ± 0.278 2 HIPnr,YPC 39.17 S K114 HD 218511 14.986 ± 0.186 1 HIPnr 0.53 D K115 HIP 1368 14.987 ± 0.199 2 YPC,HIPnr 0.68 S D K116 HD 200779 15.100 ± 0.213 2 YPC,HIPnr 0.59 S D K117 HD 36705 15.165 ± 0.131 1 HIPnr 0.63 D K118 HD 224953 15.323 ± 0.416 1 HIPnr 0.53 D K119 TYC 8112-1978-2 15.347 ± 0.286 2 HIPnr,YPC 0.55 D K120 HD 34673 15.351 ± 0.257 2 HIPnr,YPC 3.11 S K121 GJ 319 A 15.368 ± 0.399 3 HIPnr,HIPnr,YPC 0.57 S D K122 HD 21197 15.391 ± 0.167 2 YPC,HIPnr 0.55 S D K123 HD 24916 15.484 ± 0.249 2 YPC,HIPnr 6.04 S K124 HIP 18280 15.524 ± 0.256 2 YPC,HIPnr 0.65 S D K125 GJ 750 A 15.503 ± 0.448 2 YPC,sod99 0.61 D K126 HD 139763 15.557 ± 0.336 1 HIPnr 0.75 S D Continued on next page...

Target selection for the SUNS/DEBRIS surveys 13

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

K127 HD 4967 15.611 ± 0.261 2 HIPnr,YPC 0.52 S D

G001 HD 128620 1.338 ± 0.002 2 YPC,sod99 95.28 G002 HD 10700 3.650 ± 0.002 2 HIPnr,YPC 0.52 S G003 HD 185144 5.754 ± 0.006 2 HIPnr,YPC 1.53 S G004 HD 4614 5.943 ± 0.016 2 HIPnr,YPC 2.60 S G005 HD 20794 6.043 ± 0.007 2 HIPnr,YPC 0.52 D G006 HD 131156 6.708 ± 0.021 2 HIPnr,YPC 0.53 S D G007 CCDM 12337+4121 A 8.440 ± 0.014 2 HIPnr,YPC 0.52 S D G008 HD 115617 8.555 ± 0.016 2 HIPnr,YPC 0.62 S D G009 HD 39587 8.683 ± 0.019 2 HIPnr,YPC 15.04 S G010 HD 114710 9.132 ± 0.014 2 YPC,HIPnr 0.52 S D G011 HD 20630 9.144 ± 0.022 2 HIPnr,YPC 0.87 S D G012 HD 102365 9.221 ± 0.020 2 HIPnr,YPC 1.06 D G013 HD 101501 9.602 ± 0.024 2 HIPnr,YPC 0.52 S D G014 HD 10780 10.064 ± 0.052 2 HIPnr,YPC 26.20 S G015 HD 43834 10.199 ± 0.015 2 YPC,HIPnr 0.89 D G016 HD 13974 10.778 ± 0.045 2 HIPnr,YPC 0.61 S D G017 HD 82885 11.363 ± 0.041 2 HIPnr,YPC 0.52 S D G018 HD 20807 12.019 ± 0.020 4 HIPnr,YPC,HIPnr,YPC 0.52 D G019 HD 141004 12.122 ± 0.045 2 YPC,HIPnr 0.53 S D G020 HD 224930 12.143 ± 0.116 2 sod99,YPC 0.54 S D G021 HD 72673 12.208 ± 0.068 2 HIPnr,YPC 1.60 S G022 HD 69830 12.494 ± 0.055 2 HIPnr,YPC 0.73 S D G023 HD 34411 12.632 ± 0.045 2 HIPnr,YPC 7.16 S G024 HD 14412 12.666 ± 0.056 2 YPC,HIPnr 0.52 S D G025 HD 133640 12.740 ± 0.097 2 sod99,YPC 0.53 S D G026 CCDM 01418+4237 A 12.746 ± 0.087 2 HIPnr,YPC 0.55 S D G027 HD 147513 12.793 ± 0.061 4 HIPnr,YPC,HIPnr,YPC 14.38 S G028 HD 172051 13.087 ± 0.079 2 HIPnr,YPC 4.25 S G029 HD 30495 13.273 ± 0.063 2 HIPnr,YPC 0.54 S D G030 HD 166 13.679 ± 0.104 2 HIPnr,YPC 0.54 S D G031 HD 211415 13.785 ± 0.068 2 HIPnr,YPC 0.52 D G032 HD 146233 13.908 ± 0.071 2 HIPnr,YPC 1.97 S G033 HD 95128 14.062 ± 0.049 2 HIPnr,YPC 0.52 S D G034 HD 160269 14.180 ± 0.071 4 HIPnr,YPC,HIPnr,YPC 0.53 S D G035 HD 157214 14.325 ± 0.051 2 HIPnr,YPC 0.54 S D G036 HD 72905 14.359 ± 0.074 2 HIPnr,YPC 0.71 S D G037 HD 196761 14.380 ± 0.083 2 HIPnr,YPC 0.55 S D G038 HD 140538 14.661 ± 0.142 1 HIPnr 0.67 S D G039 HD 136352 14.809 ± 0.088 2 YPC,HIPnr 2.73 G040 HD 86728 15.052 ± 0.071 2 YPC,HIPnr 0.52 S D G041 HD 4391 15.174 ± 0.092 2 YPC,HIPnr 0.52 D G042 HD 38858 15.175 ± 0.094 1 HIPnr 6.56 S G043 HD 140901 15.350 ± 0.094 2 HIPnr,YPC 2.70 S G044 GJ 25 A 15.352 ± 0.234 2 YPC,sod99 0.52 S D G045 HD 41593 15.405 ± 0.139 2 YPC,HIPnr 23.89 S G046 GJ 188 A 15.436 ± 0.078 2 YPC,HIPnr 6.27 S G047 HD 160691 15.506 ± 0.074 2 HIPnr,YPC 1.68 G048 HD 217014 15.612 ± 0.092 2 HIPnr,YPC 0.53 S D G049 HD 182488 15.769 ± 0.087 2 YPC,HIPnr 1.72 S G050 HD 116442 15.787 ± 0.235 2 HIPnr,HIPnr 0.52 S D G051 HD 190360 15.873 ± 0.085 3 HIPnr,YPC,YPC 91.72 S G052 HD 142373 15.894 ± 0.053 2 HIPnr,YPC 0.52 S D G053 HD 207129 15.997 ± 0.090 2 HIPnr,YPC 0.52 D G054 HD 158614 16.376 ± 0.178 2 YPC,HIPnr 2.82 S G055 HD 64096 16.511 ± 0.155 2 YPC,HIPnr 0.87 S D G056 HD 43162 16.720 ± 0.137 1 HIPnr 0.53 S D G057 HD 111395 16.938 ± 0.129 1 HIPnr 0.52 S D G058 HD 25680 16.939 ± 0.097 2 HIPnr,YPC 3.12 S G059 HD 53705 16.939 ± 0.220 5 HIPnr,HIPnr,YPC,HIPnr,YPC 0.75 D G060 HD 177565 16.950 ± 0.135 2 YPC,HIPnr 4.97 S Continued on next page...

14 N. M. Phillips et al.

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

G061 HD 122742 16.965 ± 0.178 2 YPC,HIPnr 0.52 S D G062 HD 62613 17.183 ± 0.106 2 YPC,HIPnr 0.53 D G063 HD 126053 17.188 ± 0.153 2 YPC,HIPnr 0.53 S D G064 HD 143761 17.235 ± 0.083 1 HIPnr 0.53 S D G065 HD 50692 17.237 ± 0.122 2 HIPnr,YPC 0.58 S D G066 HD 152391 17.238 ± 0.195 2 YPC,HIPnr 1.73 S G067 HD 142267 17.349 ± 0.163 1 HIPnr 0.55 S D G068 HD 76151 17.390 ± 0.114 2 YPC,HIPnr 0.52 S D G069 HD 102438 17.472 ± 0.125 2 HIPnr,YPC 0.55 S D G070 HD 1237 17.498 ± 0.095 1 HIPnr 0.62 D G071 HD 165185 17.553 ± 0.148 2 HIPnr,YPC 1.71 S G072 HD 200968 17.562 ± 0.185 2 HIPnr,YPC 0.55 S D G073 HD 115383 17.563 ± 0.080 2 YPC,HIPnr 0.52 S D G074 HD 193664 17.567 ± 0.074 2 HIPnr,YPC 5.89 S G075 HD 165499 17.618 ± 0.161 2 HIPnr,YPC 0.63 D G076 GJ 580 A 17.656 ± 0.151 2 HIPnr,YPC 0.97 S D G077 HD 189567 17.727 ± 0.138 2 YPC,HIPnr 0.56 D G078 HD 190406 17.764 ± 0.110 2 YPC,HIPnr 3.18 S G079 HD 99491 17.777 ± 0.210 3 HIPnr,HIPnr,YPC 0.54 S D G080 HD 206860 17.876 ± 0.144 2 HIPnr,YPC 0.63 S D G081 HD 137107 17.923 ± 0.251 2 HIPnr,YPC 0.52 S D G082 HD 42807 17.942 ± 0.141 2 YPC,HIPnr 8.20 S G083 HD 202940 17.974 ± 0.203 2 HIPnr,YPC 0.58 S D G084 HD 130948 18.171 ± 0.112 2 HIPnr,YPC 0.54 S D G085 HD 39091 18.316 ± 0.070 2 HIPnr,YPC 0.84 D G086 HD 84737 18.344 ± 0.094 2 HIPnr,YPC 0.52 S D G087 HD 222335 18.578 ± 0.217 2 HIPnr,YPC 0.52 S D G088 HD 154345 18.582 ± 0.110 2 HIPnr,YPC 0.53 S D G089 HD 4747 18.672 ± 0.188 2 HIPnr,YPC 0.52 S D G090 HD 190771 18.796 ± 0.127 2 HIPnr,YPC 15.16 S G091 HD 181321 18.829 ± 0.500 1 HIPnr 0.90 S D G092 HD 9540 19.034 ± 0.166 2 HIPnr,YPC 0.52 S D G093 HD 52711 19.163 ± 0.150 2 YPC,HIPnr 0.65 S D G094 HD 78366 19.183 ± 0.121 1 HIPnr 0.52 S D G095 HD 36435 19.196 ± 0.166 2 YPC,HIPnr 0.53 D G096 HD 43587 19.250 ± 0.148 2 YPC,HIPnr 5.84 S G097 HD 120690 19.461 ± 0.166 2 HIPnr,YPC 0.62 S D G098 HD 194640 19.518 ± 0.202 2 HIPnr,YPC 0.62 S D G099 HD 157347 19.524 ± 0.152 1 HIPnr 5.44 S G100 HD 79028 19.569 ± 0.122 2 YPC,HIPnr 0.53 S D G101 HD 136923 19.600 ± 0.242 1 HIPnr 0.60 S D G102 CCDM 22583-0224 A 19.865 ± 0.150 1 HIPnr 0.61 S D G103 HD 128642 19.885 ± 0.190 1 HIPnr 0.53 D G104 HD 137763 19.934 ± 0.282 3 YPC,HIPnr,HIPnr 0.98 S D G105 HD 128400 19.996 ± 0.172 1 HIPnr 1.28 G106 HD 180161 20.021 ± 0.128 2 HIPnr,YPC 0.62 S D G107 HD 212698 20.191 ± 0.487 2 HIPnr,YPC 0.53 S D G108 HD 89269 20.243 ± 0.205 1 HIPnr 0.52 S D G109 GJ 337 A 20.369 ± 0.227 2 HIPnr,YPC 0.53 S D G110 HD 203244 20.416 ± 0.283 1 HIPnr 0.53 D G111 HD 24496 20.416 ± 0.292 1 HIPnr 2.68 S G112 HD 184385 20.563 ± 0.266 1 HIPnr 156.51 S G113 HD 212330 20.569 ± 0.144 2 YPC,HIPnr 0.52 D G114 HD 9407 20.659 ± 0.170 2 YPC,HIPnr 12.81 S G115 HD 18803 20.662 ± 0.200 2 YPC,HIPnr 1.26 S G116 HD 112758 20.854 ± 0.394 2 HIPnr,YPC 0.54 S D G117 HD 197076 20.896 ± 0.206 2 HIPnr,YPC 0.70 S D G118 HD 1835 20.923 ± 0.229 2 YPC,HIPnr 0.53 S D G119 HD 76932 21.035 ± 0.137 1 HIPnr 0.70 S D G120 HD 186408 21.156 ± 0.084 3 HIPnr,YPC,HIPnr 0.85 S D G121 HD 117043 21.160 ± 0.139 1 HIPnr 0.52 S D G122 HD 146361 21.196 ± 0.485 3 YPC,HIPnr,HIPnr 0.52 D Continued on next page...

Target selection for the SUNS/DEBRIS surveys 15

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

G123 HD 124580 21.209 ± 0.189 1 HIPnr 0.82 D G124 HD 26923 21.244 ± 0.175 2 HIPnr,HIPnr 1.83 G125 HD 141272 21.295 ± 0.363 1 HIPnr 0.80 D

F001 HD 61421 3.507 ± 0.013 2 YPC,HIPnr 0.57 S D F002 HD 170153 8.032 ± 0.033 2 YPC,sod99 0.56 S D F003 HD 30652 8.069 ± 0.011 2 YPC,HIPnr 0.76 S D F004 HD 98231 8.368 ± 0.055 2 YPC,sod99 0.52 S D F005 HD 1581 8.586 ± 0.012 2 HIPnr,YPC 0.52 D F006 HD 38393 8.926 ± 0.014 2 YPC,HIPnr 0.53 S D F007 HD 203608 9.261 ± 0.016 2 YPC,HIPnr 0.53 D F008 HD 19373 10.542 ± 0.026 2 YPC,HIPnr 8.04 S F009 HD 102870 10.928 ± 0.026 2 YPC,HIPnr 0.52 S D F010 GJ 107 A 11.128 ± 0.028 2 HIPnr,YPC 2.17 S F011 HD 142860 11.255 ± 0.023 2 YPC,HIPnr 0.54 S D F012 HD 33262 11.645 ± 0.024 3 YPC,HIPnr,HIPnr 0.53 D F013 HD 210027 11.719 ± 0.086 2 YPC,HIPnr 0.65 S D F014 HD 110379 11.745 ± 0.080 2 HIPnr,YPC 0.53 S D F015 HD 207098 11.869 ± 0.027 2 HIPnr,YPC 0.56 S D F016 HD 147584 12.113 ± 0.076 2 YPC,HIPnr 0.68 D F017 HD 141891 12.378 ± 0.025 2 YPC,HIPnr 1.98 F018 HD 90839 12.785 ± 0.047 3 YPC,YPC,HIPnr 0.52 S D F019 HD 82328 13.481 ± 0.024 2 YPC,HIPnr 0.52 S D F020 HD 9826 13.495 ± 0.035 2 YPC,HIPnr 0.63 S D F021 HD 222368 13.716 ± 0.028 2 YPC,HIPnr 0.63 S D F022 HD 22484 13.977 ± 0.105 2 YPC,HIPnr 0.62 S D F023 HD 20010 14.235 ± 0.091 2 YPC,HIPnr 0.52 S D F024 HD 17206 14.237 ± 0.365 2 YPC,HIPnr 0.53 S D F025 HD 35296 14.370 ± 0.075 4 YPC,HIPnr,YPC,HIPnr 3.07 S F026 HD 126660 14.528 ± 0.030 2 YPC,HIPnr 0.52 S D F027 HD 197692 14.677 ± 0.058 2 YPC,HIPnr 0.61 S D F028 HD 40136 14.879 ± 0.055 2 YPC,HIPnr 2.98 S F029 HD 176051 14.881 ± 0.081 2 YPC,HIPnr 0.59 S D F030 HD 105452 14.936 ± 0.036 2 YPC,HIPnr 0.63 S D F031 HD 84117 15.009 ± 0.045 2 YPC,HIPnr 0.57 S D F032 HD 7570 15.115 ± 0.055 2 YPC,HIPnr 0.52 D F033 HD 63077 15.210 ± 0.118 2 YPC,HIPnr 29.28 S F034 HD 153597 15.271 ± 0.077 2 YPC,HIPnr 0.52 S D F035 HD 182640 15.451 ± 0.234 2 YPC,HIPnr 3.61 S F036 HD 120136 15.622 ± 0.049 2 YPC,HIPnr 0.52 S D F037 HD 165908 15.660 ± 0.083 2 YPC,HIPnr 0.57 S D F038 HD 4813 15.753 ± 0.087 2 YPC,HIPnr 0.53 S D F039 HD 128167 15.828 ± 0.065 2 YPC,HIPnr 0.52 S D F040 GJ 332 A 16.061 ± 0.172 2 YPC,HIPnr 0.52 S D F041 HD 65907 16.205 ± 0.055 1 HIPnr 1.26 F042 HD 90589 16.226 ± 0.032 2 YPC,HIPnr 1.86 F043 HD 215648 16.296 ± 0.053 2 HIPnr,YPC 0.56 S D F044 HD 48682 16.714 ± 0.084 2 YPC,HIPnr 0.73 S D F045 HD 55575 16.889 ± 0.094 1 HIPnr 0.78 S D F046 HD 17051 17.168 ± 0.065 2 YPC,HIPnr 0.53 D F047 HD 177474 17.272 ± 0.223 2 YPC,HIPnr 6.03 S F048 HD 81997 17.313 ± 0.602 2 HIPnr,YPC 0.53 S D F049 HD 156897 17.355 ± 0.078 2 HIPnr,YPC 15.01 S F050 HD 110897 17.372 ± 0.096 2 YPC,HIPnr 0.52 S D F051 HD 10647 17.434 ± 0.076 1 HIPnr 0.53 D F052 HD 139664 17.437 ± 0.049 2 YPC,HIPnr 2.75 F053 HD 23754 17.609 ± 0.059 2 HIPnr,YPC 0.52 S D F054 HD 160915 17.655 ± 0.075 2 HIPnr,YPC 10.43 S F055 HD 114378 17.828 ± 0.282 2 HIPnr,YPC 0.52 S D F056 HD 46588 17.879 ± 0.086 2 YPC,HIPnr 0.58 S D F057 GJ 292 A 17.935 ± 0.109 2 YPC,HIPnr 37.04 S F058 HD 58946 18.022 ± 0.078 4 HIPnr,HIPnr,YPC,YPC 0.59 S D Continued on next page...

16 N. M. Phillips et al.

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

F059 HD 125276 18.052 ± 0.266 2 HIPnr,YPC 0.63 S D F060 HD 114837 18.199 ± 0.099 2 YPC,HIPnr 13.92 F061 HD 69897 18.268 ± 0.107 2 HIPnr,YPC 0.53 S D F062 HD 129502 18.282 ± 0.067 2 HIPnr,YPC 0.57 S D F063 HD 109085 18.282 ± 0.060 2 HIPnr,YPC 0.54 S D F064 HD 210302 18.283 ± 0.094 2 HIPnr,YPC 0.52 S D F065 HD 185395 18.332 ± 0.050 2 YPC,HIPnr 0.67 S D F066 GJ 822 A 18.439 ± 0.181 2 HIPnr,YPC 0.59 S D F067 GJ 271 A 18.515 ± 0.228 2 HIPnr,YPC 0.58 S D F068 HD 5015 18.742 ± 0.116 2 HIPnr,YPC 14.17 S F069 HD 693 18.743 ± 0.225 2 HIPnr,YPC 0.52 S D F070 HD 82434 18.808 ± 0.127 2 YPC,HIPnr 5.18 F071 HD 25457 18.833 ± 0.113 2 HIPnr,YPC 2.57 S F072 HD 187691 19.192 ± 0.107 2 HIPnr,YPC 3.51 S F073 HD 173667 19.209 ± 0.088 2 HIPnr,YPC 1.86 S F074 HD 43386 19.241 ± 0.100 2 HIPnr,YPC 9.50 S F075 HD 119756 19.407 ± 0.072 2 YPC,HIPnr 0.56 S D F076 HD 134083 19.550 ± 0.118 2 HIPnr,YPC 0.55 S D F077 HD 71243 19.566 ± 0.046 2 HIPnr,YPC 0.87 D F078 HD 105211 19.739 ± 0.047 2 HIPnr,YPC 37.31 F079 GJ 818.1 A 19.814 ± 0.591 2 HIPnr,YPC 0.61 D F080 HD 68456 19.867 ± 0.997 2 YPC,HIPnr 1.21 F081 HD 29875 20.165 ± 0.057 2 HIPnr,YPC 0.52 D F082 HD 58855 20.241 ± 0.147 2 HIPnr,YPC 0.64 S D F083 HD 202444 20.326 ± 0.165 2 HIPnr,YPC 1.81 S F084 HD 78154 20.378 ± 0.153 2 YPC,HIPnr 0.64 S D F085 HD 27290 20.461 ± 0.151 2 YPC,HIPnr 0.52 D F086 HD 219623 20.512 ± 0.109 2 HIPnr,YPC 2.50 S F087 HD 219482 20.542 ± 0.139 1 HIPnr 0.52 D F088 HD 154417 20.681 ± 0.171 2 HIPnr,YPC 1.53 S F089 HD 43042 20.811 ± 0.147 2 HIPnr,YPC 61.13 S F090 HD 33564 20.886 ± 0.092 2 YPC,HIPnr 0.72 S D F091 HD 25998 20.897 ± 0.104 3 HIPnr,YPC,HIPnr 11.61 S F092 HD 3196 21.109 ± 0.300 2 YPC,HIPnr 0.53 S D F093 GJ 55.3 A 21.103 ± 0.163 3 YPC,HIPnr,HIPnr 0.52 D F094 HD 187013 21.135 ± 0.110 4 YPC,sod99,HIPnr,YPC 3.44 S F095 HD 189245 21.249 ± 0.180 2 YPC,HIPnr 0.94 S D F096 HD 739 21.281 ± 0.122 1 HIPnr 0.52 S D F097 HD 89449 21.372 ± 0.110 2 YPC,HIPnr 0.53 S D F098 HD 55892 21.422 ± 0.073 2 HIPnr,YPC 1.11 D F099 HD 160032 21.447 ± 0.152 2 HIPnr,YPC 1.12 D F100 HD 90089 21.507 ± 0.643 2 YPC,HIPnr 0.52 D F101 HD 22001 21.681 ± 0.056 2 YPC,HIPnr 0.61 D F102 HD 16673 21.763 ± 0.194 1 HIPnr 0.52 S D F103 HD 108954 21.782 ± 0.166 1 HIPnr 0.52 S D F104 HD 91324 21.815 ± 0.090 2 HIPnr,YPC 4.05 F105 HD 199260 21.977 ± 0.183 2 HIPnr,YPC 0.68 S D F106 HD 206826 22.204 ± 0.211 2 HIPnr,YPC 0.70 S D F107 CCDM 19598-0957 A 22.243 ± 0.491 2 YPC,HIPnr 1.40 S F108 HD 106516 22.336 ± 0.404 1 HIPnr 0.57 S D F109 HD 68146 22.377 ± 0.150 2 YPC,HIPnr 0.64 S D F110 HD 19994 22.588 ± 0.143 2 YPC,HIPnr 0.62 S D F111 HD 213845 22.681 ± 0.134 2 YPC,HIPnr 0.53 S D F112 HD 16765 22.687 ± 0.428 2 YPC,HIPnr 0.53 S D F113 HD 89125 22.789 ± 0.181 2 YPC,HIPnr 0.53 S D F114 HD 168151 22.906 ± 0.089 2 YPC,HIPnr 0.53 S D F115 HD 162003 22.918 ± 0.177 3 YPC,HIPnr,HIPnr 0.54 S D F116 HD 167425 23.047 ± 0.207 1 HIPnr 0.63 D F117 HD 219571 23.066 ± 0.335 2 HIPnr,YPC 0.52 D F118 HD 160922 23.165 ± 0.091 2 HIPnr,YPC 0.54 S D F119 HD 11171 23.175 ± 0.139 3 YPC,HIPnr,HIPnr 0.52 S D F120 HD 101177 23.195 ± 0.391 2 HIPnr,YPC 0.52 S D Continued on next page...

Target selection for the SUNS/DEBRIS surveys 17

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

F121 HD 100180 23.326 ± 0.658 1 HIPnr 0.53 S D F122 HD 7439 23.375 ± 0.164 2 HIPnr,YPC 0.72 S D F123 HD 190422 23.441 ± 0.247 1 HIPnr 0.56 D F124 HD 4676 23.451 ± 0.148 2 YPC,HIPnr 0.81 S D F125 HD 164259 23.559 ± 0.183 2 HIPnr,YPC 23.57 S F126 HD 214953 23.621 ± 0.223 2 YPC,HIPnr 0.52 D F127 HD 99028 23.760 ± 0.462 2 YPC,HIPnr 0.53 S F128 HIP 46733 23.816 ± 0.091 2 YPC,HIPnr 0.54 S F129 HD 111456 24.072 ± 1.527 2 YPC,HIPnr 0.52 S F130 GJ 105.4 A 24.114 ± 0.746 2 sod99,YPC 0.53 S

A001 HD 48915 2.631 ± 0.009 2 HIPnr,YPC 6.21 S A002 HD 187642 5.125 ± 0.014 2 YPC,HIPnr 1.24 S D A003 HD 172167 7.681 ± 0.021 2 YPC,HIPnr 0.59 S A004 HD 216956 7.701 ± 0.028 2 HIPnr,YPC 0.52 S A005 HD 102647 11.011 ± 0.063 2 HIPnr,YPC 0.54 S D A006 HD 60179 14.005 ± 0.408 2 HIPnr,YPC 0.54 S D A007 HD 76644 14.509 ± 0.034 2 YPC,HIPnr 0.52 S D A008 HD 159561 14.941 ± 0.230 2 YPC,HIPnr 1.26 S A009 HD 203280 15.038 ± 0.025 2 HIPnr,YPC 7.42 S A010 HD 128898 16.568 ± 0.038 2 HIPnr,YPC 6.41 A011 HD 97603 17.918 ± 0.080 2 YPC,HIPnr 0.52 S D A012 HD 11636 17.965 ± 0.187 2 YPC,HIPnr 0.64 S D A013 HD 115892 18.021 ± 0.055 2 YPC,HIPnr 0.56 S D A014 HD 39060 19.440 ± 0.042 2 HIPnr,YPC 0.55 A015 HD 141795 21.610 ± 0.089 2 HIPnr,YPC 0.62 S D A016 HD 38678 21.612 ± 0.075 2 YPC,HIPnr 0.91 S D A017 HD 118098 22.724 ± 0.098 2 YPC,HIPnr 0.53 S D A018 HD 139006 23.007 ± 0.148 2 YPC,HIPnr 0.55 S D A019 HD 156164 23.038 ± 0.080 2 HIPnr,YPC 0.54 S D A020 HD 130841 23.206 ± 0.092 4 YPC,HIPnr,HIPnr,YPC 0.68 S D A021 HD 2262 23.807 ± 0.091 2 YPC,HIPnr 0.52 D A022 HD 197157 24.171 ± 0.146 2 YPC,HIPnr 0.53 D A023 HD 16970 24.348 ± 0.367 3 HIPnr,YPC,YPC 0.53 S D A024 HD 95418 24.455 ± 0.096 2 YPC,HIPnr 0.52 S D A025 HD 74956 24.688 ± 0.237 2 YPC,HIPnr 4.13 A026 HD 106591 24.688 ± 0.085 2 YPC,HIPnr 0.52 S D A027 HD 40183 24.910 ± 0.136 2 HIPnr,YPC 1.62 S A028 CCDM 13240+5456 A 25.064 ± 0.088 4 YPC,HIPnr,HIPnr,YPC 0.52 S D A029 HD 99211 25.246 ± 0.127 1 HIPnr 0.53 S D A030 HD 177724 25.465 ± 0.110 2 YPC,HIPnr 17.92 S A031 HD 157792 25.509 ± 0.156 2 HIPnr,YPC 26.39 S A032 HD 103287 25.510 ± 0.260 1 HIPnr 0.52 S D A033 CCDM 02449+1007 A 25.767 ± 0.212 2 HIPnr,YPC 2.34 S A034 HD 165777 26.620 ± 0.156 2 HIPnr,YPC 1.14 S D A035 HD 108767 26.637 ± 0.113 2 YPC,HIPnr 0.54 S D A036 CCDM 19026-2953 A 27.027 ± 0.635 1 HIPnr 0.89 S D A037 HD 155125 27.064 ± 0.584 2 HIPnr,YPC 4.44 S A038 HD 18978 27.168 ± 0.140 2 HIPnr,YPC 0.52 S D A039 HD 180777 27.303 ± 0.142 2 HIPnr,YPC 0.64 S D A040 HD 33111 27.362 ± 0.314 2 HIPnr,YPC 0.63 S D A041 HD 210418 28.180 ± 0.671 2 HIPnr,YPC 0.83 S D A042 HD 87696 28.238 ± 0.144 2 HIPnr,YPC 0.52 S D A043 HD 172555 28.539 ± 0.155 2 HIPnr,YPC 0.59 D A044 HD 70060 28.560 ± 0.139 2 HIPnr,YPC 15.67 S A045 HD 78209 28.818 ± 0.208 1 HIPnr 0.52 S D A046 HD 173880 28.908 ± 0.383 2 HIPnr,YPC 3.11 S A047 HD 27045 28.944 ± 0.318 1 HIPnr 4.99 S A048 HD 125161 29.067 ± 0.161 2 YPC,HIPnr 0.52 S D A049 HD 50241 29.398 ± 1.528 2 YPC,HIPnr 0.73 D A050 HD 209790 29.601 ± 0.916 2 YPC,HIPnr 10.97 S A051 HD 202730 30.256 ± 0.448 2 HIPnr,YPC 0.52 D Continued on next page...

18 N. M. Phillips et al.

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

A052 HD 159560 30.351 ± 0.106 3 HIPnr,HIPnr,YPC 0.54 S D A053 HD 125162 30.355 ± 0.147 2 YPC,HIPnr 0.52 S D A054 HD 8538 30.487 ± 0.130 2 YPC,HIPnr 10.02 S A055 HD 135379 30.550 ± 0.177 2 HIPnr,YPC 87.99 A056 HD 56537 30.888 ± 0.210 2 HIPnr,YPC 0.77 S D A057 HD 88955 31.075 ± 0.145 2 HIPnr,YPC 0.83 D A058 HD 213558 31.446 ± 0.119 2 YPC,HIPnr 1.89 S A059 HD 161868 31.513 ± 0.208 2 YPC,HIPnr 3.50 S A060 HD 47105 31.757 ± 1.926 2 HIPnr,YPC 4.76 S A061 HD 188228 32.217 ± 0.176 1 HIPnr 0.65 D A062 HD 83446 32.321 ± 0.167 1 HIPnr 23.07 A063 HD 222603 32.681 ± 0.203 2 HIPnr,YPC 0.53 S D A064 HD 20320 33.650 ± 0.328 2 HIPnr,YPC 0.59 S D A065 CCDM 15278+2906 A 34.281 ± 0.892 2 HIPnr,YPC 0.52 S D A066 HD 104513 34.282 ± 0.881 1 HIPnr 0.52 S D A067 HD 14055 34.397 ± 0.284 2 YPC,HIPnr 0.61 S D A068 HD 91312 34.627 ± 0.623 2 YPC,HIPnr 0.52 S D A069 HD 112413 35.247 ± 1.093 3 HIPnr,YPC,HIPnr 0.52 S D A070 HD 12111 35.262 ± 0.532 2 HIPnr,YPC 8.99 S A071 HD 109536 35.540 ± 0.354 2 YPC,HIPnr 0.66 D A072 HD 31295 35.676 ± 0.318 1 HIPnr 3.40 S A073 HD 16754 35.723 ± 2.754 2 YPC,HIPnr 0.52 D A074 HD 79439 35.837 ± 0.257 2 HIPnr,YPC 0.52 S D A075 HD 25490 35.854 ± 0.244 2 HIPnr,YPC 1.76 S A076 HD 110411 36.258 ± 0.276 1 HIPnr 0.52 S D A077 HD 17093 36.367 ± 0.528 2 HIPnr,YPC 0.81 S D A078 HD 184006 37.216 ± 0.152 1 HIPnr 1.02 S D A079 HD 102124 37.411 ± 0.350 2 HIPnr,YPC 0.52 S D A080 HD 177196 37.434 ± 0.238 2 HIPnr,YPC 0.56 S D A081 HD 44769 37.427 ± 0.882 3 HIPnr,YPC,HIPnr 6.59 S A082 HD 71155 37.514 ± 0.267 2 YPC,HIPnr 0.53 S D A083 HD 80081 38.181 ± 1.119 2 YPC,HIPnr 0.52 S D A084 HD 78045 38.283 ± 0.176 2 YPC,HIPnr 0.85 D A085 HD 178253 38.428 ± 0.369 2 YPC,HIPnr 4.40 S A086 HD 13161 38.865 ± 0.514 1 HIPnr 0.65 S D A087 HD 95608 38.956 ± 0.258 1 HIPnr 0.52 S D A088 HD 102249 38.971 ± 0.516 1 HIPnr 8.93 A089 HD 215789 39.497 ± 0.748 2 HIPnr,YPC 0.52 D A090 HD 5448 39.602 ± 1.341 2 HIPnr,YPC 0.55 S D A091 HD 137898 39.718 ± 0.489 2 YPC,HIPnr 0.56 S D A092 HD 165040 39.853 ± 0.270 2 HIPnr,YPC 0.59 D A093 HD 110304 39.872 ± 0.429 1 HIPnr 0.87 D A094 HD 49434 39.968 ± 0.543 1 HIPnr 16.76 S A095 HD 109787 40.249 ± 0.858 2 YPC,HIPnr 0.92 D A096 HD 154494 40.900 ± 0.635 2 YPC,HIPnr 0.64 S D A097 CCDM 16278-0822 A 40.954 ± 1.519 2 HIPnr,YPC 1.82 S A098 HD 85376 40.961 ± 2.342 2 YPC,HIPnr 0.52 S D A099 HD 6961 40.967 ± 0.403 1 HIPnr 3.80 S A100 HD 198639 40.969 ± 0.369 2 YPC,HIPnr 145.12 S A101 HD 130109 41.244 ± 0.323 2 YPC,HIPnr 0.54 S D A102 HD 146624 41.269 ± 0.375 2 HIPnr,YPC 4.26 S A103 HD 1404 41.291 ± 0.358 2 HIPnr,YPC 0.58 S D A104 HD 90132 41.477 ± 0.464 1 HIPnr 0.57 S D A105 HD 19107 41.562 ± 0.708 2 YPC,HIPnr 0.64 S D A106 HD 210049 41.592 ± 1.674 2 YPC,HIPnr 0.53 S D A107 HD 165189 41.788 ± 1.170 1 HIPnr 0.83 D A108 HD 46304 41.806 ± 0.437 1 HIPnr 6.66 S A109 HD 223352 42.115 ± 0.408 2 YPC,HIPnr 0.52 S D A110 HD 89021 42.129 ± 1.378 2 YPC,HIPnr 0.52 S D A111 HD 123998 42.337 ± 0.323 1 HIPnr 2.41 A112 HD 15089 42.383 ± 1.433 2 sod99,YPC 14.67 S A113 HD 23281 42.391 ± 0.898 1 HIPnr 0.66 S D Continued on next page...

Target selection for the SUNS/DEBRIS surveys 19

Table 3. System information (continued)

UNS ID Primary d N_π References C_{PACS,110} Surveys (pc) (mJy/beam)

A114 HD 28527 42.493 ± 0.442 4 YPC,YPC,HIPnr,HIPnr 6.02 S A115 HD 37594 42.553 ± 0.670 1 HIPnr 5.19 S A116 HD 192640 42.685 ± 0.401 2 HIPnr,YPC 82.97 S A117 HD 197950 42.744 ± 0.384 2 HIPnr,YPC 3.59 S A118 HD 15008 42.809 ± 0.623 2 HIPnr,YPC 0.53 D A119 HD 212728 43.141 ± 0.670 1 HIPnr 0.52 D A120 HD 186219 43.576 ± 0.645 2 YPC,HIPnr 0.64 D A121 HD 222345 43.611 ± 1.997 1 HIPnr 0.53 S D A122 HD 48097 43.630 ± 1.275 1 HIPnr 2.74 S A123 HD 213398 43.804 ± 0.422 2 YPC,HIPnr 0.52 S D A124 CCDM 16035-5747 A 43.883 ± 1.729 2 YPC,sod99 6.25 A125 HD 159492 44.500 ± 0.515 2 YPC,HIPnr 1.28 A126 HD 37507 44.534 ± 0.892 2 HIPnr,YPC 123.02 S A127 HD 140436 44.621 ± 1.010 2 YPC,HIPnr 0.53 S D A128 HD 141296 45.269 ± 0.758 1 HIPnr 4.74 A129 HD 28546 45.355 ± 0.851 4 YPC,YPC,HIPnr,HIPnr 8.81 A130 HD 16555 45.538 ± 2.276 2 HIPnr,YPC 0.53 D

Table 4. Component names, positions and proper motions: ‘Primary’ column contains ‘P’ for primary component; ‘Reference’ column gives the reference for position and proper motion; ρ column gives separation of component from primary if larger than 1.0^{′′}. ρ should be considered approximate, and time variable for smaller separations (of order 100 AU or less). It is advised to check orbital solutions to find relative positions for a particular epoch.

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

M001 P HIP 87937 17 57 48.50 +04 41 35.8 -798.8 10277.3 NLTT M002 P GJ 406 10 56 28.99 +07 00 52.0 -3841.6 -2725.1 LHS M003 P HD 95735 11 03 20.20 +35 58 11.6 -577.0 -4761.8 NLTT M004 P GJ 65 A 01 39 01.54 −17 57 01.8 3296.2 563.9 NLTT M004 GJ 65 B 01 39 01.54 −17 57 01.8 3296.2 563.9 NLTT M005 P HIP 92403 18 49 49.37 −23 50 10.4 644.2 -192.9 NLTT M006 P GJ 905 23 41 55.00 +44 10 38.9 100.0 -1594.1 NLTT M007 P HD 217987 23 05 52.04 −35 51 11.1 6767.3 1326.7 NLTT M008 P HIP 57548 11 47 44.40 +00 48 16.4 605.6 -1219.2 NLTT M009 P GJ 866 AB 22 38 33.62 −15 17 59.2 2314.8 2295.3 NLTT M010 P HD 173739 18 42 46.68 +59 37 49.4 -1326.9 1802.1 NLTT M010 HD 173740 18 42 46.90 +59 37 36.6 -1393.2 1845.7 NLTT 12.9 M011 P HD 1326 00 18 22.88 +44 01 22.6 2887.5 408.9 NLTT M011 GJ 15 B 00 18 25.81 +44 01 38.0 2876.8 341.3 NLTT 35.1 M012 P GJ 1111 08 29 49.35 +26 46 33.7 -1111.7 -612.4 NLTT M013 P LHS 1565 03 35 59.71 −44 30 45.4 731.6 -384.1 hen06 M014 P HIP 5643 01 12 30.64 −16 59 56.5 1241.5 616.3 dea05 M015 P HIP 36208 07 27 24.50 +05 13 32.9 573.6 -3691.0 NLTT M016 P SO 0253+1652 02 53 00.89 +16 52 52.7 3403.8 -3807.0 hen06 M017 P HD 33793 05 11 40.61 −45 01 06.7 6544.2 -5774.3 NLTT M018 P HD 239960 22 27 59.47 +57 41 45.1 -870.2 -471.1 NLTT M018 GJ 860 B 22 27 59.97 +57 41 44.4 -713.4 -320.7 TDSC 4.1 M019 P GJ 234 A 06 29 23.40 −02 48 50.3 694.7 -618.6 NLTT M019 GJ 234 B 06 29 23.40 −02 48 50.3 694.7 -618.6 NLTT M020 P HIP 80824 16 30 18.06 −12 39 45.3 -89.7 -1184.8 NLTT M021 P HD 225213 00 05 24.43 −37 21 26.5 5639.4 -2340.9 NLTT M022 P GJ 473 A 12 33 17.50 +09 01 14.1 -1720.7 179.0 LHS M022 GJ 473 B 12 33 17.50 +09 01 14.1 -1720.7 179.0 LHS M023 P GJ 83.1 02 00 12.96 +13 03 06.7 1091.3 -1780.0 NLTT M024 P HIP 86162 17 36 25.90 +68 20 20.9 -320.5 -1270.7 NLTT M025 P GJ 3622 10 48 12.62 −11 20 09.7 580.3 -1531.1 NLTT M026 P HIP 85523 17 28 39.95 −46 53 42.7 573.7 -878.1 NLTT M027 P GJ 1245 A 19 53 54.48 +44 24 53.3 443.4 -581.2 NLTT M027 GJ 1245 B 19 53 55.14 +44 24 54.1 443.4 -581.2 NLTT 7.1 Continued on next page...

20 N. M. Phillips et al.

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

M028 P HIP 113020 22 53 16.74 −14 15 49.3 960.2 -672.1 NLTT M029 P GJ 1002 00 06 43.20 −07 32 17.1 -749.4 -1922.1 dea05 M030 P GJ 3618 10 44 21.23 −61 12 35.6 -350.0 1605.2 hen06 M031 P HIP 54211 11 05 28.57 +43 31 36.4 -4418.0 943.3 NLTT M031 GJ 412 B 11 05 30.90 +43 31 17.9 -4328.5 952.8 NLTT 31.4 M032 P GJ 388 10 19 36.27 +19 52 12.1 -501.8 -42.8 NLTT M033 P HD 204961 21 33 33.98 −49 00 32.4 -46.2 -818.0 NLTT M034 P HIP 86214 17 37 03.66 −44 19 09.2 -710.1 -938.0 NLTT M035 P HIP 112460 22 46 49.73 +44 20 02.4 -705.6 -460.3 NLTT M036 P GJ 1116 B 08 58 15.13 +19 45 47.1 -846.7 -65.6 NLTT M036 GJ 1116 A 08 58 15.13 +19 45 47.1 -846.7 -65.6 NLTT M037 P GJ 3379 06 00 03.52 +02 42 23.6 309.8 -40.8 hen06 M038 P GJ 3323 05 01 57.43 −06 56 46.5 -561.8 -525.7 hen06 M039 P HIP 57544 11 47 41.38 +78 41 28.2 743.8 477.5 NLTT M040 P HD 119850 13 45 43.78 +14 53 29.5 1777.9 -1455.2 NLTT M041 P GJ 169.1 A 04 31 11.52 +58 58 37.5 1300.2 -2049.0 NLTT M041 GJ 169.1 B 04 31 12.38 +58 58 37.7 1300.0 -2049.0 gou04 6.7 M042 P HD 265866 06 54 48.96 +33 16 05.4 -727.6 -401.8 NLTT M043 P HD 36395 05 31 27.40 −03 40 38.0 765.1 -2092.1 NLTT M044 P HIP 103039 20 52 33.02 −16 58 29.1 -306.7 30.8 NLTT M045 P HD 42581 06 10 34.61 −21 51 52.6 -139.4 -703.7 NLTT M046 P HIP 86990 17 46 34.23 −57 19 08.6 -1120.3 -1353.0 NLTT M047 P HD 180617 19 16 55.26 +05 10 08.0 -577.4 -1334.8 NLTT M047 GJ 752 B 19 16 57.60 +05 09 01.6 -610.0 -1369.0 gou04 75.1 M048 P HIP 26857 05 42 09.27 +12 29 21.6 2001.4 -1572.9 NLTT M049 P LHS 60 19 20 47.98 −45 33 29.7 640.8 -2890.5 jao05 M050 P HIP 76074 15 32 12.93 −41 16 32.1 -1174.9 -1030.4 NLTT M051 P CCDM 00155-1608 A 00 15 28.11 −16 08 01.7 728.2 -617.5 NLTT M051 CCDM 00155-1608 B 00 15 28.11 −16 08 01.7 728.2 -617.5 NLTT M052 P HIP 117473 23 49 12.52 +02 24 04.4 995.1 -968.2 NLTT M053 P HIP 37766 07 44 40.17 +03 33 08.9 -348.5 -446.9 NLTT M054 P HIP 34603 07 10 01.83 +38 31 46.1 -445.4 -943.3 NLTT M055 P HIP 71253 14 34 16.82 −12 31 10.2 -342.5 600.5 jao05 M056 P HIP 74995 15 19 26.83 −07 43 20.3 -1219.0 -91.7 jao05 M057 P GJ 896 A 23 31 52.17 +19 56 14.3 543.2 -44.6 NLTT M057 GJ 896 B 23 31 52.56 +19 56 13.9 602.6 17.3 NLTT 5.5 M058 P LHS 2090 09 00 23.55 +21 50 04.8 -509.8 -582.3 hen06 M059 P GJ 3737 12 38 49.10 −38 22 53.8 -651.1 -1311.6 hen06 M060 P GJ 661 A 17 12 07.83 +45 39 57.7 252.6 -1571.8 NLTT M060 GJ 661 B 17 12 07.83 +45 39 57.7 252.6 -1571.8 NLTT M061 P GJ 3959 16 31 18.46 +40 51 54.1 -176.4 310.6 CNS3 M062 P GJ 644 A 16 55 28.77 −08 20 11.0 -809.9 -894.0 NLTT M062 GJ 644 B 16 55 28.77 −08 20 11.0 -809.9 -894.0 NLTT M062 HIP 82809 16 55 25.22 −08 19 21.3 -813.5 -895.2 NLTT 72.3 M062 GJ 644 C 16 55 35.25 −08 23 40.6 -770.7 -871.0 dea05 230.7 M063 P HIP 80459 16 25 24.62 +54 18 14.7 434.4 -174.0 NLTT M064 P LHS 271 09 42 46.36 −68 53 06.0 111.3 1115.0 jao05 M065 P GJ 1156 12 18 59.49 +11 07 32.8 -1246.1 186.5 LHS M066 P GJ 3877 14 56 38.25 −28 09 48.6 -497.0 -827.1 NLTT M067 P HIP 53767 11 00 04.26 +22 49 58.7 -427.0 -280.8 NLTT M068 P HIP 106106 21 29 36.81 +17 38 35.8 1010.2 376.1 NLTT M069 P GJ 3522 08 58 56.33 +08 28 26.0 385.1 -323.1 hen06 M070 P HIP 53020 10 50 52.06 +06 48 29.3 -804.4 -809.6 NLTT M071 P HD 216899 22 56 34.80 +16 33 12.4 -1032.8 -284.1 NLTT M072 P GJ 299 08 11 57.67 +08 46 22.2 1099.3 -5123.4 LHS M073 P GJ 3193 B 03 01 51.39 −16 35 36.0 -387.8 -277.7 hen06 M073 NLTT 9671 03 01 51.04 −16 35 31.0 -395.1 -271.5 hen06 7.1 M073 CCDM 03019-1635 C 03 01 51.28 −16 35 34.7 -387.8 -277.7 hen06,CCDM 2.0 M074 P LHS 22 04 10 28.14 −53 36 08.2 -835.6 -2412.9 jao05 M075 P HD 199305 20 53 19.79 +62 09 15.8 0.8 -775.0 NLTT M076 P HIP 51317 10 28 55.55 +00 50 27.6 -601.9 -734.5 NLTT M077 P GJ 4063 18 34 36.65 +40 07 26.4 57.9 -203.0 NLTT Continued on next page...

Target selection for the SUNS/DEBRIS surveys 21

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

M078 P GJ 1286 23 35 10.54 −02 23 22.9 849.7 -957.3 LHS M079 P GJ 4053 18 18 57.40 +66 11 32.4 464.4 -469.0 LHS M080 P NLTT 54872 22 48 04.50 −24 22 07.8 323.3 -174.8 NLTT M081 P GJ 4274 22 23 06.99 −17 36 26.3 248.3 -895.2 dea05 M082 P GJ 4248 22 02 29.39 −37 04 51.3 792.4 -213.8 hen06 M083 P HIP 83945 17 09 31.55 +43 40 52.9 333.9 -278.0 NLTT M084 P GJ 1224 18 07 32.86 −15 57 47.1 -617.4 -342.6 NLTT M085 P GJ 3378 06 01 11.13 +59 35 49.9 -60.0 -978.2 LHS M086 P HIP 12781 02 44 15.51 +25 31 24.1 862.5 -360.7 NLTT M087 P HIP 65859 13 29 59.78 +10 22 37.8 1127.1 -1074.3 NLTT M088 P GJ 3207 03 11 35.22 −38 47 22.7 837.6 -194.9 LHS M089 P GJ 2005 00 24 44.21 −27 08 24.4 -92.5 602.6 NLTT M090 P GJ 1093 06 59 28.82 +19 20 55.8 902.8 -905.7 NLTT M091 P HD 165222 18 05 07.58 −03 01 52.8 571.6 -334.6 NLTT M092 P HIP 61874 12 40 46.29 −43 33 59.0 -782.0 693.5 NLTT M093 P HIP 5496 01 10 22.90 −67 26 41.9 372.7 571.7 hen06 M094 P GJ 831 A 21 31 18.61 −09 47 26.4 1161.8 -54.2 NLTT M094 GJ 831 B 21 31 18.62 −09 47 26.6 1161.8 -54.2 NLTT,CCDM M095 P HIP 49986 10 12 17.67 −03 44 44.4 -150.7 -245.2 NLTT M096 P LHS 1989 08 12 40.88 −21 33 06.8 15.9 -698.6 hen06 M097 P HIP 101180 20 30 32.05 +65 26 58.4 445.8 282.3 NLTT M098 P HIP 80346 16 24 09.32 +48 21 10.5 1144.2 -450.8 NLTT M099 P GJ 257 A 06 57 46.60 −44 17 28.3 -1102.2 -42.6 NLTT M099 GJ 257 B 06 57 46.59 −44 17 27.0 -1102.2 -42.6 TDSC,NLTT 1.4 M100 P HIP 86287 17 37 53.35 +18 35 30.1 926.6 982.1 NLTT M101 P GJ 1289 23 43 06.28 +36 32 14.0 930.2 -135.7 LHS M102 P SCR 0740-4257 07 40 11.80 −42 57 40.1 -476.8 531.4 SCR M103 P GJ 493.1 13 00 33.54 +05 41 08.5 -939.5 241.2 LHS M104 P GJ 747 A 19 07 42.99 +32 32 41.3 1235.4 1130.2 NLTT M104 GJ 747 B 19 07 43.02 +32 32 41.3 1235.4 1130.2 NLTT,CCDM M105 P SCR 1138-7721 11 38 16.76 −77 21 48.5 -2054.9 624.3 hen06 M106 P GJ 1151 11 50 57.81 +48 22 37.8 -1512.2 -976.4 LHS M107 P GJ 1227 18 22 27.28 +62 03 00.8 -919.4 -1260.3 LHS M108 P HIP 4856 01 02 32.23 +71 40 47.3 1744.2 -381.4 NLTT M109 P HIP 38956 07 58 12.70 +41 18 13.3 212.4 -685.1 NLTT M110 P GJ 1230 B 18 41 09.86 +24 47 13.9 517.3 53.2 LHS M110 GJ 1230 A 18 41 09.86 +24 47 13.9 517.0 55.3 LHS M111 P GJ 618 A 16 20 03.51 −37 31 44.4 -740.1 997.4 NLTT M111 GJ 618 B 16 20 03.24 −37 31 49.1 -740.0 997.0 gou04 5.7 M112 P HIP 62452 12 47 56.62 +09 45 05.0 -1007.7 -461.0 NLTT M113 P GJ 232 06 24 41.29 +23 25 58.7 545.1 -515.1 NLTT M114 P GJ 1154 AB 12 14 16.62 +00 37 23.8 -907.1 -314.3 LHS M115 P GJ 3146 02 16 29.85 +13 35 12.7 501.7 -437.7 NLTT M116 P GJ 1057 03 13 22.98 +04 46 27.7 1759.6 39.6 LHS M117 P GJ 3454 07 36 25.13 +07 04 43.1 238.9 -317.0 hen06

K001 P HD 22049 03 32 55.84 −09 27 29.7 -976.1 18.1 NLTT K002 P HD 201091 21 06 53.94 +38 44 57.9 4155.1 3258.9 NLTT K002 HD 201092 21 06 55.27 +38 44 31.3 4117.1 3128.0 NLTT 30.8 K003 P HD 209100 22 03 21.66 −56 47 09.5 3959.1 -2538.3 NLTT K003 2MASS 22041052-5646577 22 04 10.59 −56 46 58.1 4157.4 -2478.3 dea05 402.2 K004 P HD 202560 21 17 15.27 −38 52 02.5 -3259.0 -1147.0 NLTT K005 P HD 88230 10 11 22.14 +49 27 15.2 -1359.8 -505.7 NLTT K006 P HD 26965 04 15 16.32 −07 39 10.3 -2239.3 -3419.9 NLTT K006 HD 26976 04 15 21.50 −07 39 22.3 -2239.3 -3419.9 NLTT 77.9 K006 GJ 166 C 04 15 21.50 −07 39 22.3 -2239.3 -3419.9 NLTT 77.9 K007 P HD 165341 18 05 27.37 +02 29 59.3 276.3 -1091.8 NLTT K007 GJ 702 B 18 05 27.42 +02 29 56.4 442.1 -1253.0 NLTT 2.9 K008 P HD 131977 14 57 28.00 −21 24 55.8 1035.7 -1734.9 NLTT K008 HD 131976 14 57 26.54 −21 24 41.5 987.0 -1666.8 NLTT 24.9 K009 P HD 155886 17 15 20.98 −26 36 10.2 -473.7 -1143.9 NLTT K009 HD 155885 17 15 20.98 −26 36 10.2 -473.7 -1143.9 NLTT Continued on next page...

22 N. M. Phillips et al.

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

K009 HD 156026 17 16 13.36 −26 32 46.1 -480.4 -1123.3 NLTT 731.8 K010 P HD 191408 20 11 11.94 −36 06 04.3 458.4 -1569.3 NLTT K010 GJ 783 B 20 11 12.08 −36 06 06.5 522.2 -1691.2 LHS 2.8 K011 P HD 79210 09 14 22.77 +52 41 11.8 -1555.6 -570.0 NLTT K011 HD 79211 09 14 24.69 +52 41 10.9 -1560.8 -660.6 NLTT 17.5 K012 P HD 191849 20 13 53.39 −45 09 50.5 777.8 -159.2 NLTT K013 P HD 219134 23 13 16.98 +57 10 06.1 2074.5 295.4 NLTT K014 P HD 16160 02 36 04.89 +06 53 12.7 1806.3 1442.5 NLTT K014 GJ 105 B 02 36 15.25 +06 52 18.1 1792.0 1460.0 gou04 163.6 K015 P HD 156384 17 18 57.17 −34 59 24.0 1169.9 -173.0 PPM K015 GJ 667 B 17 18 57.18 −34 59 23.3 1149.2 -90.8 NLTT K015 GJ 667 C 17 18 58.83 −34 59 48.5 1149.2 -90.8 NLTT 31.9 K016 P HD 4628 00 48 22.98 +05 16 50.3 757.3 -1135.4 NLTT K017 P HD 10476 01 42 29.76 +20 16 06.6 -300.6 -673.7 NLTT K018 P HD 6582 01 08 16.38 +54 55 13.2 3412.3 -1600.1 NLTT K018 GJ 53 B 01 08 16.38 +54 55 13.2 3412.3 -1600.1 NLTT K019 P HD 216803 22 56 24.05 −31 33 56.0 334.0 -157.1 NLTT K020 P HD 10361 01 39 47.85 −56 11 36.3 302.6 -14.1 TDSC,NLTT K020 HD 10360 01 39 47.56 −56 11 47.3 302.6 -14.1 NLTT 11.3 K021 P HD 157881 17 25 45.23 +02 06 41.1 -579.1 -1183.2 NLTT K022 P HD 217357 23 00 16.12 −22 31 27.6 -900.1 58.6 NLTT K023 P HD 32450 05 02 28.41 −21 15 24.2 -150.7 -257.7 NLTT K023 GJ 185 B 05 02 28.46 −21 15 23.7 -150.7 -257.7 NLTT K024 P HD 32147 05 00 49.00 −05 45 13.2 550.4 -1110.2 NLTT K025 P HD 50281 06 52 18.05 −05 10 25.4 -544.2 -2.5 NLTT K025 GJ 250 B 06 52 18.07 −05 11 23.2 -575.0 -4.0 CCDM 57.8 K026 P HD 156274 17 19 03.85 −46 38 10.2 1053.5 144.0 NLTT K026 GJ 666 B 17 19 02.99 −46 38 13.1 973.0 137.8 NLTT 9.4 K027 P HD 192310 20 15 17.39 −27 01 58.7 1241.9 -180.8 NLTT K028 P HD 103095 11 52 58.77 +37 43 07.2 4003.7 -5813.0 NLTT K029 P HD 100623 11 34 29.49 −32 49 52.8 -669.9 825.2 NLTT K029 GJ 432 B 11 34 30.66 −32 50 04.0 -670.0 825.0 gou04 18.6 K030 P HD 149661 16 36 21.45 −02 19 28.5 455.0 -308.1 NLTT K031 P HD 151288 16 45 06.35 +33 30 33.2 -40.0 380.2 NLTT K032 P HD 122064 13 57 32.06 +61 29 34.3 -31.4 217.2 NLTT K033 P HD 232979 04 37 40.93 +52 53 37.0 303.7 -475.6 NLTT K034 P HD 103932 11 57 56.21 −27 42 25.4 -1078.2 -620.1 NLTT K035 P HD 17925 02 52 32.13 −12 46 11.0 397.3 -189.9 NLTT K036 P HD 111631 12 50 43.57 −00 46 05.3 -29.8 -396.9 NLTT K037 P HD 154363 17 05 03.40 −05 03 59.4 -915.6 -1139.2 NLTT K037 HIP 83599 17 05 13.78 −05 05 39.2 -921.2 -1128.2 NLTT 184.4 K038 P HD 13445 02 10 25.99 −50 49 25.3 2150.3 673.2 NLTT K039 P HD 147379 16 16 42.75 +67 14 19.8 -493.8 83.8 NLTT K039 HIP 79762 16 16 45.32 +67 15 22.5 -477.4 91.6 NLTT 64.4 K040 P HD 223778 23 52 25.28 +75 32 40.5 325.8 45.6 NLTT K040 GJ 909 B 23 52 26.51 +75 32 40.1 325.8 45.6 NLTT,CCDM 4.6 K041 P HIP 66459 13 37 28.77 +35 43 04.0 318.3 -58.2 NLTT K042 P HD 160346 17 39 16.92 +03 33 18.8 -178.5 -99.8 NLTT K043 P HD 11507 01 52 49.17 −22 26 05.5 845.3 0.4 NLTT K044 P HD 166620 18 09 37.41 +38 27 28.0 -318.9 -467.8 NLTT K045 P HD 3651 00 39 21.81 +21 15 01.7 -460.6 -369.8 NLTT K046 P HD 115404 13 16 51.05 +17 01 01.9 623.9 -259.0 NLTT K046 GJ 505 B 13 16 51.54 +17 00 59.9 631.2 -260.8 NLTT 7.3 K047 P HD 74576 08 43 18.03 −38 52 56.5 -300.4 342.9 NLTT K048 P HD 85512 09 51 07.05 −43 30 10.0 461.6 -469.9 NLTT K049 P HD 75632 08 55 24.82 +70 47 39.2 -1358.7 -375.6 NLTT K049 GJ 325 B 08 55 24.90 +70 47 38.5 -1324.4 -349.9 NLTT K050 P GJ 4 A 00 05 41.03 +45 48 43.3 878.7 -153.9 NLTT K050 GJ 4 B 00 05 41.01 +45 48 37.1 878.7 -153.9 NLTT 6.1 K050 HIP 428 00 05 10.89 +45 47 11.6 869.8 -150.7 NLTT 328.2 K051 P HD 245409 05 36 30.99 +11 19 40.3 -0.7 -57.5 TYC2 K052 P HD 222237 23 39 37.39 −72 43 19.7 141.1 -736.9 NLTT Continued on next page...

Target selection for the SUNS/DEBRIS surveys 23

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

K053 P HD 131511 14 53 23.77 +19 09 10.1 -441.0 217.1 NLTT K054 P HD 125072 14 19 04.83 −59 22 44.5 -454.5 -810.0 NLTT K055 P CCDM 15009+4526 A 15 00 55.58 +45 25 34.4 241.1 370.5 NLTT K055 CCDM 15009+4526 B 15 00 55.58 +45 25 34.4 241.1 370.5 NLTT K056 P HD 97101 11 11 05.17 +30 26 45.7 590.8 -197.7 NLTT K056 GJ 414 B 11 11 02.54 +30 26 41.1 598.7 -220.9 NLTT 34.3 K057 P HD 196877 20 42 18.78 −52 41 57.4 81.5 -1065.8 NLTT K058 P HD 37394 05 41 20.34 +53 28 51.8 3.5 -523.6 NLTT K058 HD 233153 05 41 30.73 +53 29 23.3 3.2 -517.3 NLTT 98.0 K059 P HD 101581 11 41 02.47 −44 24 18.7 -658.7 244.4 NLTT K060 P HD 75732 08 52 35.81 +28 19 51.0 -484.8 -233.5 NLTT K060 GJ 324 B 08 52 40.89 +28 18 58.8 -475.5 -247.1 NLTT 85.0 K061 P HD 21531 03 27 52.40 −19 48 16.1 535.0 304.1 NLTT K062 P HD 158633 17 25 00.10 +67 18 24.1 -529.4 2.1 NLTT K063 P HD 190007 20 02 47.04 +03 19 34.3 -88.2 121.6 TYC2 K064 P HD 82106 09 29 54.83 +05 39 18.5 -502.4 109.7 NLTT K065 P HD 40307 05 54 04.24 −60 01 24.5 -52.5 -59.7 TYC2 K066 P HD 36003 05 28 26.10 −03 29 58.4 -305.7 -796.9 NLTT K067 P HD 27274 04 15 56.90 −53 18 35.3 784.9 396.1 NLTT K068 P HD 166348 18 12 21.39 −43 26 41.4 133.1 -415.4 NLTT K069 P HD 98712 11 21 26.67 −20 27 13.6 181.7 -117.5 NLTT K069 GJ 425 B 11 21 26.56 −20 27 09.3 178.5 -115.2 NLTT 4.5 K070 P HIP 67090 13 45 05.08 +17 47 07.6 455.7 -1832.9 NLTT K071 P HD 29697 04 41 18.86 +20 54 05.4 -233.9 -254.3 NLTT K072 P HD 128165 14 33 28.87 +52 54 31.6 -191.8 247.4 NLTT K073 P HD 170657 18 31 18.96 −18 54 31.7 -138.8 -195.5 NLTT K074 P HD 120476 13 49 04.00 +26 58 47.7 -427.4 -89.9 NLTT K074 GJ 528 B 13 49 04.05 +26 58 44.1 -436.0 -110.8 NLTT 3.6 K075 P GJ 428 A 11 24 40.34 −61 38 51.1 -490.8 98.9 NLTT K075 GJ 428 B 11 24 39.48 −61 38 54.3 -561.7 77.4 NLTT 6.9 K076 P HD 211970 22 22 16.21 −54 33 38.2 -182.5 235.4 NLTT K077 P HD 214749 22 40 43.39 −29 40 28.1 383.0 -18.1 NLTT K078 P HD 10436 01 43 40.72 +63 49 24.2 -395.8 -582.7 NLTT K079 P HD 22496 03 35 00.94 −48 25 08.9 404.4 309.2 NLTT K080 P HD 154577 17 10 10.35 −60 43 43.6 72.2 590.1 NLTT K081 P HIP 61094 12 31 15.81 +08 48 38.2 -636.3 -520.8 NLTT K082 P HIP 27188 05 45 48.28 +62 14 12.4 297.3 -787.1 NLTT K083 P HIP 42220 08 36 25.46 +67 17 42.3 -1063.8 48.6 NLTT K084 P HD 145417 16 13 48.56 −57 34 13.8 -857.7 -1409.3 NLTT K085 P HD 184489 19 34 39.84 +04 34 57.0 524.5 311.3 NLTT K086 P GJ 400 A 10 45 21.49 +38 30 42.4 -34.5 147.8 TDSC K086 GJ 400 B 10 45 21.49 +38 30 42.4 -34.5 147.8 TDSC K087 P HD 23356 03 43 55.34 −19 06 39.2 308.7 156.7 NLTT K088 P HD 216133 22 50 19.42 −07 05 24.4 -106.0 104.4 TYC2 K089 P HD 5133 00 53 01.14 −30 21 24.9 622.2 31.8 NLTT K090 P HD 61606 07 39 59.33 −03 35 51.0 71.7 -276.1 NLTT K090 GJ 282 B 07 40 02.90 −03 36 13.3 66.8 -286.2 NLTT 57.9 K090 HIP 36985 07 36 07.08 −03 06 38.8 36.3 -253.5 NLTT 3894.3 K091 P HD 234078 13 52 00.00 +49 57 03.3 422.6 -139.7 NLTT K092 P HD 110315 12 41 06.48 +15 22 35.8 122.1 -390.5 NLTT K093 P HD 173818 18 47 27.25 −03 38 23.4 -132.6 -276.3 NLTT K094 P HD 150689 16 44 15.02 −38 56 37.1 -18.5 -58.4 TYC2 K094 CCDM 16453-3848 A 16 45 16.97 −38 48 33.2 -18.6 -56.3 TDSC 870.4 K094 CCDM 16453-3848 B 16 45 16.97 −38 48 33.2 -18.6 -56.3 TDSC 870.4 K095 P HD 120467 13 49 44.81 −22 06 39.9 -1749.8 -494.7 NLTT K096 P HIP 70218 14 21 57.22 +29 37 46.6 -631.4 -306.7 NLTT K097 P HIP 44722 09 06 45.35 −08 48 24.6 -301.2 208.0 NLTT K098 P HD 144579 16 04 56.79 +39 09 23.4 -571.9 52.2 NLTT K098 GJ 611 B 16 04 50.85 +39 09 36.0 -565.3 47.7 NLTT 70.3 K099 P HIP 37288 07 39 23.04 +02 11 01.2 -147.6 -247.3 NLTT K100 P HD 57095 07 17 29.57 −46 58 45.3 -14.3 585.1 NLTT K100 GJ 269 B 07 17 29.52 −46 58 46.0 -14.3 585.1 NLTT Continued on next page...

24 N. M. Phillips et al.

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

K101 P HD 205390 21 36 41.24 −50 50 43.4 424.7 -196.8 NLTT K102 P HD 97584 11 15 11.91 +73 28 30.7 -401.7 110.4 NLTT K102 GJ 420 B 11 15 10.92 +73 28 35.9 -403.8 112.1 NLTT 6.6 K103 P HD 120036 13 47 42.16 −32 25 48.1 84.7 -23.7 TDSC K103 GJ 1177 B 13 47 42.85 −32 25 51.0 88.2 -62.7 TDSC 9.2 K104 P HD 52698 07 01 13.74 −25 56 55.4 203.3 37.5 NLTT K105 P HD 144628 16 09 42.79 −56 26 42.5 -136.1 334.5 NLTT K106 P HD 142709 15 57 40.74 −42 37 27.2 -257.9 -190.5 NLTT K107 P HD 19305 03 06 26.74 +01 57 54.6 389.9 -926.9 NLTT K108 P HIP 13375 02 52 07.14 +34 23 21.7 996.5 -990.5 NLTT K109 P HD 118926 13 40 07.13 −04 11 10.0 -385.8 482.2 NLTT K110 P HD 45088 06 26 10.25 +18 45 24.8 -115.3 -167.8 NLTT K110 CCDM 06262+1845 B 06 26 10.25 +18 45 24.8 -115.3 -167.8 NLTT K111 P HD 110833 12 44 14.53 +51 45 33.5 -389.8 -176.9 NLTT K112 P HD 221503 23 32 49.40 −16 50 44.3 343.3 -218.6 NLTT K112 GJ 897 A 23 32 46.68 −16 45 12.4 352.0 -216.1 NLTT 334.2 K112 GJ 897 B 23 32 46.68 −16 45 12.4 352.0 -216.1 NLTT 334.2 K113 P HIP 5247 01 07 08.20 +63 56 28.8 1546.5 318.0 NLTT K114 P HD 218511 23 09 40.95 −67 43 58.2 -316.7 -214.8 NLTT K115 P HIP 1368 00 17 06.38 +40 56 53.9 568.9 81.3 NLTT K116 P HD 200779 21 05 19.75 +07 04 09.5 80.1 -564.2 NLTT K117 P HD 36705 05 28 44.85 −65 26 55.0 48.9 137.6 TDSC K117 CCDM 05287-6527 B 05 28 44.27 −65 26 45.7 48.9 137.6 TDSC,CCDM 10.0 K118 P HD 224953 00 02 08.72 −68 16 50.6 195.2 -209.9 NLTT K118 GJ 1294 B 00 02 09.35 −68 16 53.2 207.4 -231.8 NLTT 4.4 K119 P TYC 8112-1978-1 06 37 11.24 −50 02 17.8 173.1 11.0 NLTT K119 TYC 8112-1978-2 06 37 11.13 −50 02 19.7 159.0 13.6 NLTT 2.2 K120 P HD 34673 05 19 12.66 −03 04 25.8 696.9 127.1 NLTT K120 GJ 200 B 05 19 12.66 −03 04 25.8 696.9 127.1 NLTT K121 P GJ 319 A 08 42 44.53 +09 33 24.2 210.0 -623.3 TDSC K121 GJ 319 B 08 42 44.53 +09 33 24.2 210.0 -623.3 NLTT K121 HIP 42762 08 42 52.23 +09 33 11.2 223.7 -616.1 NLTT 114.7 K122 P HD 21197 03 24 59.73 −05 21 49.5 -230.4 -768.7 NLTT K123 P HD 24916 03 57 28.70 −01 09 34.0 -181.9 -141.9 NLTT K123 GJ 157 B 03 57 28.92 −01 09 23.4 -182.4 -139.1 NLTT 11.1 K124 P HIP 18280 03 54 35.47 −06 49 33.6 -5.1 528.3 NLTT K125 P GJ 750 A 19 16 42.92 −45 53 21.6 215.7 -412.9 NLTT K125 GJ 750 B 19 16 42.92 −45 53 21.6 215.7 -412.9 NLTT K126 P HD 139763 15 40 34.57 −18 02 56.5 161.7 88.8 NLTT K127 P HD 4967 00 51 34.02 −22 54 36.2 611.8 -274.5 NLTT K127 GJ 40 B 00 51 35.14 −22 54 30.6 612.0 -275.0 gou04 16.5

G001 P HD 128620 14 39 36.50 −60 50 02.3 -3678.2 481.8 NLTT G001 HD 128621 14 39 35.08 −60 50 13.8 -3600.4 952.1 NLTT 15.4 G001 HIP 70890 14 29 43.02 −62 40 46.7 -3777.2 775.4 jao05 7866.0 G002 P HD 10700 01 44 04.08 −15 56 14.9 -1721.8 854.1 NLTT G003 P HD 185144 19 32 21.59 +69 39 40.3 599.2 -1734.7 NLTT G004 P HD 4614 00 49 06.29 +57 48 54.7 1087.1 -559.7 NLTT G004 GJ 34 B 00 49 05.17 +57 49 03.8 1104.7 -493.2 TDSC 12.8 G005 P HD 20794 03 19 55.65 −43 04 11.2 3038.2 728.3 NLTT G006 P HD 131156 14 51 23.39 +19 06 01.7 165.0 -68.6 TYC G006 GJ 566 B 14 51 23.05 +19 06 06.8 89.7 -147.3 TDSC 6.9 G007 P CCDM 12337+4121 A 12 33 44.55 +41 21 26.9 -704.9 292.4 NLTT G007 CCDM 12337+4121 B 12 33 44.55 +41 21 26.9 -704.9 292.4 NLTT G008 P HD 115617 13 18 24.32 −18 18 40.3 -1069.9 -1063.8 NLTT G009 P HD 39587 05 54 22.98 +20 16 34.3 -174.6 -89.9 NLTT G010 P HD 114710 13 11 52.39 +27 52 41.5 -800.9 882.2 NLTT G011 P HD 20630 03 19 21.70 +03 22 12.7 269.7 93.6 NLTT G012 P HD 102365 11 46 31.07 −40 30 01.3 -1530.1 402.5 NLTT G012 GJ 442 B 11 46 32.69 −40 29 47.7 -1530.0 403.0 gou04 22.9 G013 P HD 101501 11 41 03.02 +34 12 05.9 -12.8 -380.6 NLTT G014 P HD 10780 01 47 44.84 +63 51 09.0 582.6 -246.1 NLTT Continued on next page...

Target selection for the SUNS/DEBRIS surveys 25

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

G015 P HD 43834 06 10 14.47 −74 45 11.0 122.0 -212.7 NLTT G016 P HD 13974 02 17 03.23 +34 13 27.2 1153.8 -245.1 NLTT G017 P HD 82885 09 35 39.51 +35 48 36.6 -723.0 -247.8 NLTT G017 GJ 356 B 09 35 39.51 +35 48 36.6 -723.0 -247.8 NLTT G018 P HD 20807 03 18 12.82 −62 30 22.9 1331.1 646.8 NLTT G018 HD 20766 03 17 46.16 −62 34 31.1 1338.4 650.3 NLTT 309.2 G019 P HD 141004 15 46 26.61 +07 21 11.1 -224.5 -69.2 NLTT G020 P HD 224930 00 02 10.19 +27 04 55.5 829.9 -989.4 TDSC G020 GJ 914 B 00 02 10.19 +27 04 55.5 829.9 -989.4 NLTT G021 P HD 72673 08 32 51.50 −31 30 03.1 -1113.7 763.1 NLTT G022 P HD 69830 08 18 23.95 −12 37 55.8 280.3 -989.5 NLTT G023 P HD 34411 05 19 08.47 +40 05 56.6 519.4 -664.8 NLTT G024 P HD 14412 02 18 58.50 −25 56 44.5 -217.7 445.2 NLTT G025 P HD 133640 15 03 47.30 +47 39 14.5 -443.7 9.9 NLTT G025 GJ 575 B 15 03 47.48 +47 39 15.9 -374.3 39.4 NLTT 2.3 G026 P CCDM 01418+4237 A 01 41 47.16 +42 36 48.4 806.6 -152.2 NLTT G026 CCDM 01418+4237 B 01 41 47.16 +42 36 48.4 806.6 -152.2 NLTT G027 P HIP 80300 16 23 33.84 −39 13 46.2 76.5 2.4 TYC2 G027 HD 147513 16 24 01.29 −39 11 34.7 72.3 3.3 TYC2 345.1 G028 P HD 172051 18 38 53.40 −21 03 06.7 -74.1 -152.5 TYC2 G029 P HD 30495 04 47 36.29 −16 56 04.0 130.4 169.8 NLTT G030 P HD 166 00 06 36.78 +29 01 17.4 380.5 -177.9 NLTT G031 P HD 211415 22 18 15.61 −53 37 37.5 436.8 -632.8 TDSC G031 GJ 853 B 22 18 15.62 −53 37 37.5 436.8 -632.8 NLTT G032 P HD 146233 16 15 37.27 −08 22 10.0 231.1 -494.6 NLTT G033 P HD 95128 10 59 27.97 +40 25 48.9 -317.2 56.6 NLTT G034 P HD 160269 17 34 59.58 +61 52 28.4 265.4 -520.9 NLTT G034 GJ 684 B 17 34 59.52 +61 52 29.8 277.4 -525.6 NLTT 1.5 G034 HIP 86087 17 35 34.48 +61 40 53.6 258.6 -514.2 NLTT 737.6 G035 P HD 157214 17 20 39.57 +32 28 03.9 135.8 -1039.9 NLTT G036 P HD 72905 08 39 11.70 +65 01 15.3 -28.9 88.5 TYC2 G037 P HD 196761 20 40 11.76 −23 46 25.9 500.2 460.8 NLTT G038 P HD 140538 15 44 01.82 +02 30 54.6 -48.0 -147.2 TDSC G038 GJ 596.1 B 15 44 02.07 +02 30 56.6 -48.0 -147.2 TDSC,CCDM 4.2 G039 P HD 136352 15 21 48.15 −48 19 03.5 -1621.1 -275.2 NLTT G040 P HD 86728 10 01 00.66 +31 55 25.2 -529.1 -430.2 NLTT G040 2MASS 10005030+3155459 10 00 50.26 +31 55 45.2 -529.1 -430.2 2MASS,NLTT 133.9 G041 P HD 4391 00 45 45.59 −47 33 07.2 183.9 78.2 NLTT G041 CCDM 00458-4733 B 00 45 44.46 −47 32 58.5 183.9 78.2 NLTT,CCDM 14.3 G042 P HD 38858 05 48 34.94 −04 05 40.7 62.2 -228.6 NLTT G043 P HD 140901 15 47 29.10 −37 54 58.7 -414.9 -213.7 NLTT G043 GJ 599 B 15 47 30.11 −37 55 08.3 -415.0 -214.0 gou04 15.2 G044 P GJ 25 A 00 37 20.68 −24 46 02.1 1391.0 -13.0 NLTT G044 GJ 25 B 00 37 20.73 −24 46 02.4 1391.0 -13.0 NLTT G045 P HD 41593 06 06 40.48 +15 32 31.6 -120.1 -103.0 TYC2 G046 P GJ 188 A 05 07 27.01 +18 38 42.2 537.4 19.3 NLTT G046 GJ 188 B 05 07 27.01 +18 38 42.2 537.4 19.3 NLTT G047 P HD 160691 17 44 08.70 −51 50 02.6 -14.4 -191.8 NLTT G048 P HD 217014 22 57 27.98 +20 46 07.8 207.9 59.8 NLTT G049 P HD 182488 19 23 34.01 +33 13 19.1 79.3 162.4 NLTT G050 P HD 116442 13 23 39.16 +02 43 24.0 13.3 199.6 NLTT G050 HD 116443 13 23 40.84 +02 43 31.0 4.8 201.3 NLTT 26.2 G051 P HD 190360 20 03 37.40 +29 53 48.5 683.7 -524.3 NLTT G051 GJ 777 B 20 03 26.56 +29 51 59.6 682.6 -530.1 NLTT 178.1 G052 P HD 142373 15 52 40.54 +42 27 05.5 440.3 630.3 NLTT G053 P HD 207129 21 48 15.75 −47 18 13.0 165.4 -294.5 NLTT G054 P HD 158614 17 30 23.80 −01 03 46.6 -126.7 -179.6 NLTT G054 GJ 678 B 17 30 23.77 −01 03 45.6 -126.7 -179.6 NLTT 1.1 G055 P HD 64096 07 51 46.31 −13 53 52.8 -60.0 -338.9 NLTT G055 GJ 291 B 07 51 46.27 −13 53 52.6 -60.0 -338.9 NLTT G056 P HD 43162 06 13 45.30 −23 51 43.0 -45.4 113.2 TYC2 G057 P HD 111395 12 48 47.05 +24 50 24.8 -335.0 -106.0 NLTT Continued on next page...

26 N. M. Phillips et al.

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

G058 P HD 25680 04 05 20.26 +22 00 32.1 172.2 -130.2 NLTT G059 P HD 53705 07 03 57.32 −43 36 28.9 -103.7 392.0 NLTT G059 HD 53706 07 03 58.93 −43 36 40.9 -98.5 383.4 NLTT 21.2 G059 HD 53680 07 03 50.22 −43 33 40.8 -93.0 395.3 NLTT 185.0 G060 P HD 177565 19 06 52.46 −37 48 38.4 -188.2 -365.6 NLTT G061 P HD 122742 14 03 32.35 +10 47 12.4 91.1 -307.5 NLTT G062 P HD 62613 07 56 17.23 +80 15 55.9 -474.8 87.7 NLTT G063 P HD 126053 14 23 15.29 +01 14 29.6 223.3 -477.8 NLTT G064 P HD 143761 16 01 02.66 +33 18 12.6 -199.1 -773.9 NLTT G065 P HD 50692 06 55 18.67 +25 22 32.5 -36.7 25.3 TYC2 G066 P HD 152391 16 52 58.80 −00 01 35.1 -709.3 -1483.7 NLTT G067 P HD 142267 15 53 12.10 +13 11 47.8 -150.3 -561.8 NLTT G068 P HD 76151 08 54 17.95 −05 26 04.1 -412.1 28.2 NLTT G069 P HD 102438 11 47 15.81 −30 17 11.4 -265.3 -227.9 NLTT G070 P HD 1237 00 16 12.68 −79 51 04.3 433.9 -58.0 NLTT G071 P HD 165185 18 06 23.72 −36 01 11.2 106.8 7.4 TYC2 G072 P HD 200968 21 07 10.38 −13 55 22.5 382.3 -39.9 NLTT G072 GJ 819 B 21 07 10.39 −13 55 26.7 362.1 -32.7 NLTT 4.2 G073 P HD 115383 13 16 46.52 +09 25 27.0 -334.9 191.0 NLTT G074 P HD 193664 20 17 31.33 +66 51 13.3 472.5 296.1 NLTT G075 P HD 165499 18 10 26.15 −62 00 08.0 -81.5 221.2 NLTT G076 P GJ 580 A 15 13 50.90 −01 21 05.0 -1270.0 -502.1 NLTT G076 GJ 580 B 15 13 50.90 −01 21 05.0 -1270.0 -502.1 NLTT G077 P HD 189567 20 05 32.77 −67 19 15.2 845.0 -673.5 NLTT G078 P HD 190406 20 04 06.23 +17 04 12.6 -392.5 -407.6 TDSC G079 P HD 99491 11 26 45.32 +03 00 47.2 -726.3 181.0 NLTT G079 HD 99492 11 26 46.28 +03 00 22.7 -728.3 185.7 NLTT 28.3 G080 P HD 206860 21 44 31.33 +14 46 19.0 231.2 -113.9 NLTT G081 P HD 137107 15 23 12.31 +30 17 16.1 125.8 -176.5 NLTT G081 HD 137108 15 23 12.35 +30 17 17.0 125.8 -176.5 TDSC,NLTT 1.0 G082 P HD 42807 06 13 12.50 +10 37 37.7 77.3 -297.3 NLTT G083 P HD 202940 21 19 45.63 −26 21 10.3 -568.3 -353.7 NLTT G083 GJ 825.4 B 21 19 45.51 −26 21 10.2 -541.1 -335.6 NLTT 1.6 G084 P HD 130948 14 50 15.81 +23 54 42.6 144.3 30.6 TYC2 G085 P HD 39091 05 37 09.89 −80 28 08.8 312.0 1050.2 NLTT G086 P HD 84737 09 48 35.37 +46 01 15.6 222.0 -93.5 NLTT G087 P HD 222335 23 39 51.31 −32 44 36.3 135.8 -304.9 NLTT G088 P HD 154345 17 02 36.40 +47 04 54.8 122.6 855.7 NLTT G089 P HD 4747 00 49 26.77 −23 12 44.9 518.8 124.7 NLTT G090 P HD 190771 20 05 09.78 +38 28 42.5 259.2 115.7 NLTT G091 P HD 181321 19 21 29.77 −34 59 00.4 87.6 -86.4 TYC2 G092 P HD 9540 01 33 15.81 −24 10 40.7 272.7 -159.4 NLTT G092 GJ 59 B 01 33 00.07 −24 14 58.6 297.5 -137.7 NLTT 336.0 G093 P HD 52711 07 03 30.46 +29 20 13.5 156.5 -827.8 NLTT G094 P HD 78366 09 08 51.07 +33 52 56.0 -192.1 -116.7 NLTT G095 P HD 36435 05 27 39.35 −60 24 57.6 -147.8 -91.8 TYC2 G096 P HD 43587 06 17 16.13 +05 06 00.3 -195.4 164.6 NLTT G097 P HD 120690 13 51 20.32 −24 23 25.7 -584.2 -290.9 NLTT G098 P HD 194640 20 27 44.25 −30 52 04.2 -13.6 -518.7 NLTT G099 P HD 157347 17 22 51.29 −02 23 17.4 50.4 -107.4 TYC2 G100 P HD 79028 09 14 20.54 +61 25 24.0 -9.8 -30.6 TYC2 G101 P HD 136923 15 22 46.83 +18 55 08.3 -230.9 77.2 NLTT G102 P CCDM 22583-0224 A 22 58 15.54 −02 23 43.4 -5.8 -15.1 TDSC G102 CCDM 22583-0224 B 22 58 15.54 −02 23 43.4 -5.8 -15.1 TDSC G103 P HD 128642 14 29 22.31 +80 48 35.5 -72.0 -129.6 TYC2 G104 P HD 137763 15 28 09.61 −09 20 53.0 76.4 -359.0 NLTT G104 HD 137778 15 28 12.21 −09 21 28.3 80.5 -355.9 NLTT 52.2 G105 P HD 128400 14 41 52.46 −75 08 22.1 119.8 -19.0 TYC2 G106 P HD 180161 19 12 11.36 +57 40 19.1 217.5 408.6 NLTT G107 P HD 212698 22 26 34.30 −16 44 31.9 251.1 -20.6 NLTT G107 HD 212697 22 26 34.27 −16 44 29.7 251.1 -20.6 NLTT 2.2 G108 P HD 89269 10 18 51.95 +44 02 54.0 61.9 -299.7 NLTT Continued on next page...

Target selection for the SUNS/DEBRIS surveys 27

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

G109 P GJ 337 A 09 12 17.55 +14 59 45.7 -522.8 245.8 TDSC G109 GJ 337 B 09 12 17.55 +14 59 45.7 -522.8 245.8 NLTT G109 2MASS 09121469+1459396 09 12 14.63 +14 59 40.1 -522.8 245.8 2MASS,NLTT 42.7 G110 P HD 203244 21 24 40.64 −68 13 40.2 139.5 172.0 NLTT G111 P HD 24496 03 54 28.04 +16 36 57.8 220.1 -166.6 NLTT G111 CCDM 03545+1637 B 03 54 27.86 +16 36 57.1 220.1 -166.6 NLTT,CCDM 2.6 G112 P HD 184385 19 33 25.55 +21 50 25.2 -21.3 -204.7 NLTT G113 P HD 212330 22 24 56.36 −57 47 50.8 150.6 -344.9 NLTT G114 P HD 9407 01 34 33.27 +68 56 53.3 -376.8 114.6 NLTT G115 P HD 18803 03 02 26.03 +26 36 33.3 232.8 -167.9 NLTT G116 P HD 112758 12 59 01.56 −09 50 02.7 -824.6 197.7 NLTT G116 GJ 491 B 12 59 01.56 −09 50 02.7 -824.6 197.7 NLTT G117 P HD 197076 20 40 45.14 +19 56 07.9 118.2 310.2 NLTT G117 GJ 797 B 20 40 45.91 +19 54 03.4 118.2 310.2 NLTT,CCDM 125.0 G118 P HD 1835 00 22 51.79 −12 12 34.0 393.9 61.0 NLTT G119 P HD 76932 08 58 43.93 −16 07 57.8 244.5 213.0 NLTT G120 P HD 186408 19 41 48.96 +50 31 30.2 -147.8 -158.7 NLTT G120 HD 186427 19 41 51.97 +50 31 03.1 -132.0 -163.0 NLTT 39.6 G121 P HD 117043 13 25 59.86 +63 15 40.6 -394.3 220.0 NLTT G122 P HD 146361 16 14 40.85 +33 51 31.0 -265.4 -83.9 NLTT G122 HD 146362 16 14 40.39 +33 51 27.1 -289.0 -85.1 NLTT 7.0 G122 HIP 79551 16 13 56.27 +33 46 24.3 -263.0 -82.9 NLTT 634.7 G123 P HD 124580 14 15 38.69 −45 00 02.7 127.6 -136.3 NLTT G124 P HD 26923 04 15 28.80 +06 11 12.7 -111.1 -106.3 TDSC G124 HD 26913 04 15 25.79 +06 11 58.8 -102.6 -112.8 TDSC 64.3 G125 P HD 141272 15 48 09.46 +01 34 18.3 -176.5 -165.8 NLTT

F001 P HD 61421 07 39 18.12 +05 13 30.0 -716.6 -1034.6 NLTT F001 GJ 280 B 07 39 18.12 +05 13 30.0 -716.6 -1034.6 NLTT F002 P HD 170153 18 21 03.38 +72 43 58.2 531.1 -351.6 NLTT F003 P HD 30652 04 49 50.41 +06 57 40.6 462.9 11.8 NLTT F004 P HD 98231 11 18 10.90 +31 31 44.9 -453.7 -591.4 NLTT F004 HD 98230 11 18 10.95 +31 31 45.7 -453.7 -591.4 NLTT F005 P HD 1581 00 20 04.26 −64 52 29.3 1708.4 1164.8 NLTT F006 P HD 38393 05 44 27.79 −22 26 54.2 -292.4 -368.5 NLTT F006 HD 38392 05 44 26.54 −22 25 18.6 -304.4 -352.2 NLTT 97.1 F007 P HD 203608 21 26 26.61 −65 21 58.3 81.1 800.7 NLTT F008 P HD 19373 03 09 04.02 +49 36 47.8 1262.6 -91.5 NLTT F009 P HD 102870 11 50 41.72 +01 45 53.0 740.3 -271.7 NLTT F010 P GJ 107 A 02 44 11.99 +49 13 42.4 334.0 -90.0 NLTT F010 GJ 107 B 02 44 10.25 +49 13 54.1 334.0 -90.0 gou04 20.7 F011 P HD 142860 15 56 27.18 +15 39 41.8 311.2 -1282.2 NLTT F012 P HD 33262 05 05 30.66 −57 28 21.7 -31.9 118.1 TYC2 F012 HIP 23708 05 05 47.37 −57 33 13.8 -33.2 120.9 TYC2 321.6 F013 P HD 210027 22 07 00.67 +25 20 42.4 297.4 26.4 NLTT F014 P HD 110379 12 41 39.64 −01 26 57.8 -616.7 60.7 NLTT F014 HD 110380 12 41 39.64 −01 26 57.8 -616.7 60.7 NLTT F015 P HD 207098 21 47 02.45 −16 07 38.2 263.3 -296.2 NLTT F016 P HD 147584 16 28 28.14 −70 05 03.8 197.8 111.5 NLTT F017 P HD 141891 15 55 08.56 −63 25 50.6 -188.4 -401.9 NLTT F018 P HD 90839 10 30 37.58 +55 58 49.9 -177.7 -32.8 NLTT F018 HD 237903 10 30 25.31 +55 59 56.8 -180.8 -33.7 NLTT 122.8 F019 P HD 82328 09 32 51.43 +51 40 38.3 -947.1 -535.6 NLTT F019 GJ 354 B 09 32 51.82 +51 40 36.3 -961.0 -567.0 CCDM 4.1 F020 P HD 9826 01 36 47.84 +41 24 19.7 -172.6 -381.0 NLTT F021 P HD 222368 23 39 57.04 +05 37 34.7 376.3 -436.5 NLTT F022 P HD 22484 03 36 52.38 +00 24 06.0 -233.4 -482.1 NLTT F023 P HD 20010 03 12 04.53 −28 59 15.4 371.5 612.3 NLTT F023 GJ 127 B 03 12 04.21 −28 59 13.0 345.8 648.3 TDSC 4.8 F024 P HD 17206 02 45 06.19 −18 34 21.2 331.4 34.5 NLTT F025 P HD 35296 05 24 25.46 +17 23 00.7 250.9 -7.2 NLTT F025 HD 35171 05 23 38.38 +17 19 26.8 251.9 -3.3 NLTT 707.2 Continued on next page...

28 N. M. Phillips et al.

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

F026 P HD 126660 14 25 11.80 +51 51 02.7 -236.8 -399.4 NLTT F026 GJ 549 B 14 25 11.58 +51 49 53.1 -243.0 -406.0 CCDM 69.6 F027 P HD 197692 20 46 05.73 −25 16 15.2 -52.6 -148.7 TRC F028 P HD 40136 05 56 24.29 −14 10 03.8 -44.6 132.4 TRC F029 P HD 176051 18 57 01.61 +32 54 04.6 202.8 -144.0 NLTT F029 GJ 738 B 18 57 01.63 +32 54 05.6 202.8 -144.0 TDSC,NLTT 1.1 F030 P HD 105452 12 08 24.82 −24 43 43.9 102.4 -36.9 TYC F031 P HD 84117 09 42 14.42 −23 54 56.0 -400.3 263.2 NLTT F032 P HD 7570 01 15 11.12 −45 31 54.0 665.2 177.6 NLTT F033 P HD 63077 07 45 34.98 −34 10 20.8 -274.1 1687.0 NLTT F033 GJ 288 B 07 45 38.49 −33 55 52.0 -246.0 1654.0 gou04 869.9 F034 P HD 153597 16 56 01.69 +65 08 05.3 237.7 52.2 NLTT F035 P HD 182640 19 25 29.90 +03 06 53.2 254.8 82.1 NLTT F036 P HD 120136 13 47 15.74 +17 27 24.8 -480.8 50.4 NLTT F036 GJ 527 B 13 47 15.85 +17 27 27.6 -458.0 -12.0 CCDM 3.2 F037 P HD 165908 18 07 01.54 +30 33 43.4 -99.6 76.7 TRC F037 GJ 704 B 18 07 01.60 +30 33 44.0 -69.0 48.1 TDSC F038 P HD 4813 00 50 07.59 −10 38 39.6 -225.4 -228.8 NLTT F039 P HD 128167 14 34 40.82 +29 44 42.5 189.1 131.6 NLTT F040 P GJ 332 A 09 00 38.37 +41 46 58.5 -487.7 -219.3 NLTT F040 GJ 332 B 09 00 38.37 +41 46 58.5 -487.7 -219.3 NLTT F041 P HD 65907 07 57 46.92 −60 18 11.1 518.0 119.6 NLTT F041 GJ 294 B 07 57 54.88 −60 17 59.0 516.3 103.0 PPM 60.4 F041 GJ 294 C 07 57 54.57 −60 17 59.0 516.3 103.0 PPM,CCDM 58.1 F042 P HD 90589 10 24 23.71 −74 01 53.8 -16.3 -28.3 TYC2 F043 P HD 215648 22 46 41.58 +12 10 22.4 233.6 -492.2 NLTT F043 GJ 872 B 22 46 42.35 +12 10 21.0 233.6 -492.2 NLTT 11.4 F044 P HD 48682 06 46 44.34 +43 34 38.7 -0.8 165.3 TDSC F045 P HD 55575 07 15 50.14 +47 14 23.9 29.6 -186.1 TYC2 F046 P HD 17051 02 42 33.47 −50 48 01.1 333.6 219.9 NLTT F047 P HD 177474 19 06 25.14 −37 03 48.5 87.7 -283.9 NLTT F047 HD 177475 19 06 25.22 −37 03 48.9 87.7 -283.9 NLTT 1.1 F048 P HD 81997 09 29 08.90 −02 46 08.4 98.9 -14.5 TYC F048 GJ 348 B 09 29 09.23 −02 45 02.8 142.2 -17.3 TDSC 65.7 F049 P HD 156897 17 21 00.37 −21 06 46.6 262.0 -204.7 NLTT F049 GJ 670 B 17 21 00.58 −21 06 44.2 262.0 -204.7 NLTT,CCDM 3.7 F050 P HD 110897 12 44 59.40 +39 16 44.1 -360.2 139.0 NLTT F051 P HD 10647 01 42 29.32 −53 44 27.0 171.2 -104.5 TYC2 F052 P HD 139664 15 41 11.38 −44 39 40.3 -168.0 -265.6 NLTT F053 P HD 23754 03 46 50.89 −23 14 59.0 -159.9 -529.1 NLTT F054 P HD 160915 17 43 25.80 −21 40 59.5 -97.6 -49.5 TRC F055 P HD 114378 13 09 59.29 +17 31 45.9 -430.1 137.8 NLTT F055 HD 114379 13 09 59.29 +17 31 46.3 -430.1 137.8 NLTT F056 P HD 46588 06 46 14.15 +79 33 53.3 -98.7 -603.3 NLTT F057 P GJ 292 A 07 52 15.67 −34 42 19.6 -192.6 236.8 NLTT F057 GJ 292 B 07 52 15.36 −34 42 19.7 -198.2 238.1 NLTT 3.7 F058 P HD 58946 07 29 06.72 +31 47 04.3 157.2 186.9 NLTT F058 GJ 274 B 07 29 06.75 +31 47 07.7 157.2 186.9 NLTT,CCDM 3.4 F058 HIP 36357 07 29 01.77 +31 59 37.8 159.7 175.8 NLTT 756.1 F059 P HD 125276 14 19 00.90 −25 48 55.5 -351.9 365.3 NLTT F059 GJ 542.1 B 14 19 00.86 −25 48 58.6 -351.9 365.3 NLTT,CCDM 3.1 F060 P HD 114837 13 14 15.14 −59 06 11.6 -249.6 -154.6 NLTT F060 CCDM 13142-5906 B 13 14 15.03 −59 06 09.1 -249.6 -154.6 NLTT,CCDM 2.7 F061 P HD 69897 08 20 03.86 +27 13 03.7 -17.6 -376.5 NLTT F062 P HD 129502 14 43 03.62 −05 39 29.5 104.2 -319.9 NLTT F063 P HD 109085 12 32 04.23 −16 11 45.6 -424.9 -57.2 NLTT F064 P HD 210302 22 10 08.78 −32 32 54.3 429.0 14.0 NLTT F065 P HD 185395 19 36 26.54 +50 13 16.0 -10.4 261.1 NLTT F065 GJ 765 B 19 36 26.89 +50 13 18.5 -10.4 261.1 NLTT,CCDM 4.2 F066 P GJ 822 A 21 14 28.81 +10 00 25.1 39.7 -304.2 NLTT F066 GJ 822 B 21 14 28.81 +10 00 25.1 39.7 -304.2 NLTT F067 P GJ 271 A 07 20 07.37 +21 58 56.3 -30.4 -14.7 TYC Continued on next page...

Target selection for the SUNS/DEBRIS surveys 29

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

F067 GJ 271 B 07 20 07.37 +21 58 56.3 -30.4 -14.7 TYC F068 P HD 5015 00 53 04.20 +61 07 26.3 -68.4 169.7 NLTT F069 P HD 693 00 11 15.86 −15 28 04.7 -82.5 -270.9 NLTT F070 P HD 82434 09 30 41.97 −40 28 00.2 -191.4 73.2 NLTT F070 GJ 351 B 09 30 41.99 −40 28 00.8 -191.4 73.2 NLTT F071 P HD 25457 04 02 36.74 −00 16 08.1 150.7 -252.0 NLTT F072 P HD 187691 19 51 01.64 +10 24 56.6 241.1 -135.9 NLTT F072 GJ 768.1 B 19 51 00.62 +10 24 39.9 241.1 -135.9 NLTT,CCDM 22.5 F073 P HD 173667 18 45 39.73 +20 32 46.7 -9.0 -336.2 NLTT F074 P HD 43386 06 16 26.62 +12 16 19.8 81.9 186.9 NLTT F075 P HD 119756 13 45 41.25 −33 02 37.4 -461.2 -146.5 NLTT F076 P HD 134083 15 07 18.07 +24 52 09.1 184.9 -163.8 NLTT F077 P HD 71243 08 18 31.55 −76 55 11.0 110.4 107.0 TYC2 F078 P HD 105211 12 06 52.90 −64 36 49.4 34.0 -37.2 TDSC F079 P GJ 818.1 A 21 09 22.45 −73 10 22.7 461.3 -287.2 NLTT F079 GJ 818.1 B 21 09 22.45 −73 10 22.7 461.3 -287.2 NLTT F079 GJ 818.1 C 21 09 23.86 −73 10 27.3 461.0 -287.0 gou04 7.7 F080 P HD 68456 08 09 00.66 −61 18 08.7 -158.8 -288.6 NLTT F081 P HD 29875 04 40 33.71 −41 51 49.5 -141.1 -74.4 TDSC F081 GJ 174.1 B 04 40 34.22 −41 51 52.9 -141.1 -74.4 TDSC,CCDM 6.6 F082 P HD 58855 07 29 55.96 +49 40 20.9 109.6 -83.0 TDSC F083 P HD 202444 21 14 47.46 +38 02 43.4 158.7 431.3 NLTT F083 GJ 822.1 B 21 14 47.46 +38 02 44.1 158.7 431.3 NLTT F083 GJ 822.1 C 21 14 46.84 +38 01 13.0 159.0 431.0 gou04 90.6 F084 P HD 78154 09 10 23.54 +67 08 02.4 7.1 -95.1 TDSC F084 GJ 335 B 09 10 23.51 +67 08 06.6 4.1 -30.0 TDSC 4.2 F085 P HD 27290 04 16 01.59 −51 29 11.9 101.5 184.7 TYC2 F086 P HD 219623 23 16 42.30 +53 12 48.5 111.5 -237.0 NLTT F087 P HD 219482 23 16 57.69 −62 00 04.3 182.2 -20.2 TYC2 F088 P HD 154417 17 05 16.82 +00 42 09.2 -16.8 -334.8 NLTT F089 P HD 43042 06 14 50.88 +19 09 23.2 -96.9 -181.9 NLTT F090 P HD 33564 05 22 33.53 +79 13 52.1 -78.5 161.0 TDSC F091 P HD 25998 04 08 36.62 +38 02 23.0 166.8 -203.1 NLTT F091 HD 25893 04 07 34.35 +38 04 28.3 174.4 -230.9 NLTT 746.0 F091 NLTT 12566 04 07 34.36 +38 04 30.2 174.4 -230.9 NLTT 746.2 F092 P HD 3196 00 35 14.88 −03 35 34.1 415.9 -23.2 NLTT F092 GJ 23 B 00 35 14.88 −03 35 34.1 415.9 -23.2 NLTT F093 P GJ 55.3 A 01 15 46.15 −68 52 33.5 404.9 108.3 NLTT F093 GJ 55.3 B 01 15 45.58 −68 52 29.6 382.7 86.5 NLTT 5.0 F093 GJ 55.1 A 01 15 00.99 −68 49 08.1 416.6 75.9 NLTT 319.3 F093 GJ 55.1 B 01 15 00.87 −68 49 08.6 416.6 75.9 TDSC,NLTT 319.4 F094 P HD 186858 19 45 33.54 +33 36 07.1 18.9 -445.8 NLTT F094 GJ 765.4 B 19 45 33.57 +33 36 04.7 18.9 -445.8 NLTT 2.5 F094 HD 187013 19 46 25.60 +33 43 39.3 23.3 -449.9 NLTT 791.8 F094 HD 225732 19 46 27.55 +33 43 48.9 23.3 -449.9 NLTT 817.3 F095 P HD 189245 20 00 20.25 −33 42 12.4 130.7 -289.5 NLTT F096 P HD 739 00 11 44.01 −35 07 59.2 169.2 115.4 NLTT F097 P HD 89449 10 19 44.17 +19 28 15.3 -229.1 -215.6 NLTT F097 NLTT 23782 10 14 53.84 +20 22 13.3 -235.8 -226.3 NLTT 5220.0 F097 NLTT 23781 10 14 53.91 +20 22 18.5 -235.8 -226.3 NLTT 5222.4 F098 P HD 55892 07 12 33.63 −46 45 33.5 -135.7 106.4 TYC2 F099 P HD 160032 17 40 23.83 −49 24 56.1 105.6 -177.0 NLTT F100 P HD 90089 10 31 04.65 +82 33 31.0 -82.2 24.2 TYC2 F101 P HD 22001 03 29 22.68 −62 56 15.1 382.7 374.1 NLTT F101 GJ 143.2 B 03 29 29.04 −62 56 47.8 383.0 374.0 gou04 54.4 F102 P HD 16673 02 40 12.42 −09 27 10.3 -138.6 -78.3 TYC2 F103 P HD 108954 12 30 50.13 +53 04 35.8 19.2 182.0 TYC2 F104 P HD 91324 10 31 21.82 −53 42 55.7 -419.3 209.9 NLTT F105 P HD 199260 20 56 47.33 −26 17 46.9 94.3 -63.9 TYC2 F106 P HD 206826 21 44 08.59 +28 44 33.4 277.4 -251.1 NLTT F106 HD 206827 21 44 08.46 +28 44 34.5 277.4 -251.1 NLTT 2.0 F107 P CCDM 19598-0957 A 19 59 47.32 −09 57 29.7 -282.0 -399.7 TDSC Continued on next page...

30 N. M. Phillips et al.

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

F107 CCDM 19598-0957 B 19 59 47.32 −09 57 29.7 -282.0 -399.7 NLTT F108 P HD 106516 12 15 10.56 −10 18 44.7 34.8 -1014.8 NLTT F109 P HD 68146 08 10 39.83 −13 47 57.1 -250.3 58.1 NLTT F109 GJ 297.2 B 08 10 34.26 −13 48 51.5 -250.2 50.7 NLTT 97.6 F110 P HD 19994 03 12 46.44 −01 11 46.0 194.1 -69.9 NLTT F110 GJ 128 B 03 12 46.36 −01 11 48.0 226.0 -66.0 CCDM 2.3 F111 P HD 213845 22 34 41.64 −20 42 29.6 221.4 -145.5 NLTT F112 P HD 16765 02 41 14.00 −00 41 44.4 222.4 -127.1 NLTT F112 TYC 4699-1214-2 02 41 13.78 −00 41 42.0 218.9 -125.3 NLTT 4.1 F113 P HD 89125 10 17 14.54 +23 06 22.4 -412.7 -97.9 NLTT F113 GJ 387 B 10 17 14.06 +23 06 25.4 -412.0 -116.0 CCDM 7.3 F114 P HD 168151 18 13 53.83 +64 23 50.2 350.8 36.4 NLTT F115 P HD 162003 17 41 56.35 +72 08 55.9 25.4 -267.8 NLTT F115 HD 162004 17 41 58.10 +72 09 24.8 29.3 -277.2 NLTT 30.1 F116 P HD 167425 18 19 40.13 −63 53 11.7 37.9 -280.4 NLTT F116 CCDM 18197-6353 B 18 19 40.09 −63 53 04.7 33.0 -276.0 CCDM 7.0 F117 P HD 219571 23 17 25.78 −58 14 08.7 -26.5 78.4 TYC2 F118 P HD 160922 17 36 57.09 +68 45 28.7 1.8 321.1 NLTT F119 P HD 11171 01 49 35.10 −10 41 11.1 -148.1 -95.7 TDSC F119 HD 11131 01 49 23.34 −10 42 12.7 -150.0 -91.1 TDSC 184.0 F120 P HD 101177 11 38 44.90 +45 06 30.3 -594.0 15.1 NLTT F120 GJ 433.2 B 11 38 44.09 +45 06 27.0 -577.3 1.5 NLTT 9.2 F121 P HD 100180 11 31 44.95 +14 21 52.2 -328.4 -190.1 NLTT F121 GJ 3670 B 11 31 44.41 +14 22 05.6 -327.9 -188.7 NLTT 15.5 F122 P HD 7439 01 14 24.04 −07 55 22.2 124.6 278.7 NLTT F122 HD 7438 01 14 22.43 −07 54 39.2 123.3 271.6 NLTT 49.1 F123 P HD 190422 20 07 35.09 −55 00 57.7 20.3 34.9 TYC2 F124 P HD 4676 00 48 58.71 +16 56 26.3 -1.9 -200.6 NLTT F125 P HD 164259 18 00 29.01 −03 41 25.0 154.3 -45.0 TYC2 F126 P HD 214953 22 42 36.88 −47 12 38.9 3.1 -326.9 NLTT F126 GJ 871 B 22 42 37.49 −47 12 42.3 3.0 -327.0 gou04 7.1 F127 P HD 99028 11 23 55.46 +10 31 46.3 152.5 -65.2 NLTT F127 TYC 858-1221-2 11 23 55.54 +10 31 45.4 152.5 -65.2 NLTT 1.5 F127 TYC 858-720-1 11 23 49.94 +10 37 07.9 158.5 -65.2 TDSC 331.7 F128 P HIP 46733 09 31 31.71 +63 03 42.8 112.0 34.7 TRC F128 PPM 17083 09 31 28.21 +63 03 42.6 88.3 23.0 PPM 23.8 F129 P HD 111456 12 48 39.46 +60 19 11.6 108.7 -1.1 TYC2 F130 P GJ 105.4 A 02 39 33.82 −11 52 19.8 145.8 -238.8 NLTT F130 GJ 105.4 B 02 39 33.82 −11 52 19.8 145.8 -238.8 NLTT

A001 P HD 48915 06 45 08.92 −16 42 58.0 -546.0 -1223.1 NLTT A001 GJ 244 B 06 45 08.92 −16 42 58.0 -546.0 -1223.1 NLTT A002 P HD 187642 19 50 47.00 +08 52 06.0 536.8 385.5 NLTT A003 P HD 172167 18 36 56.34 +38 47 01.3 201.0 287.5 NLTT A004 P HD 216956 22 57 39.05 −29 37 20.1 329.2 -164.2 NLTT A005 P HD 102647 11 49 03.58 +14 34 19.4 -499.0 -113.8 NLTT A006 P HD 60179 07 34 35.86 +31 53 17.8 -206.3 -148.2 NLTT A006 HD 60178 07 34 36.10 +31 53 18.6 -206.3 -148.2 NLTT 3.1 A006 GJ 278 C 07 34 37.45 +31 52 10.2 -206.3 -148.2 NLTT 70.6 A007 P HD 76644 08 59 12.45 +48 02 30.6 -441.1 -215.2 NLTT A007 GJ 331 B 08 59 12.58 +48 02 34.9 -441.1 -215.2 NLTT,CCDM 4.5 A007 GJ 331 C 08 59 12.58 +48 02 34.9 -441.1 -215.2 NLTT,CCDM 4.5 A008 P HD 159561 17 34 56.07 +12 33 36.1 110.1 -222.6 NLTT A009 P HD 203280 21 18 34.78 +62 35 08.1 151.6 49.1 TYC A010 P HD 128898 14 42 30.42 −64 58 30.5 -191.8 -234.1 NLTT A010 GJ 560 B 14 42 28.60 −64 58 41.4 -192.0 -234.0 gou04 15.9 A011 P HD 97603 11 14 06.50 +20 31 25.4 143.3 -130.4 NLTT A012 P HD 11636 01 54 38.41 +20 48 28.9 93.4 -107.3 TYC A013 P HD 115892 13 20 35.82 −36 42 44.3 -341.9 -87.4 NLTT A014 P HD 39060 05 47 17.09 −51 03 59.4 4.1 83.3 TYC2 A015 P HD 141795 15 50 48.97 +04 28 39.8 128.5 62.2 TYC2 A016 P HD 38678 05 46 57.34 −14 49 19.1 -19.7 -6.5 TRC Continued on next page...

Target selection for the SUNS/DEBRIS surveys 31

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

A017 P HD 118098 13 34 41.59 −00 35 45.0 -278.9 48.6 NLTT A018 P HD 139006 15 34 41.26 +26 42 52.9 103.5 -85.9 TRC A019 P HD 156164 17 15 01.91 +24 50 21.1 -20.3 -157.6 TDSC A020 P HD 130841 14 50 52.72 −16 02 30.4 -105.5 -68.4 TDSC A020 HD 130819 14 50 41.20 −15 59 50.1 -107.5 -69.1 TRC 230.8 A021 P HD 2262 00 26 12.20 −43 40 47.4 106.4 31.4 TYC2 A022 P HD 197157 20 44 02.33 −51 55 15.5 155.0 -54.8 TYC2 A023 P HD 16970 02 43 18.04 +03 14 08.9 -146.4 -145.3 NLTT A023 GJ 106.1 B 02 43 18.04 +03 14 08.9 -146.4 -145.3 NLTT A023 GJ 106.1 C 02 42 32.54 +03 22 26.1 -141.8 -146.4 NLTT 843.5 A024 P HD 95418 11 01 50.49 +56 22 56.8 93.7 36.8 TRC A025 P HD 74956 08 44 42.23 −54 42 31.8 28.8 -104.1 TDSC A026 P HD 106591 12 15 25.57 +57 01 57.5 107.5 17.7 TRC A027 P HD 40183 05 59 31.72 +44 56 50.8 -64.2 3.8 TRC A028 P CCDM 13240+5456 A 13 23 55.54 +54 55 31.3 121.2 -22.0 TDSC A028 CCDM 13240+5456 B 13 23 55.54 +54 55 31.3 115.4 -25.7 TYC A028 HD 116657 13 23 56.33 +54 55 18.6 121.2 -22.0 TDSC 14.4 A028 HD 116842 13 25 13.54 +54 59 16.6 119.0 -18.3 TDSC 708.5 A029 P HD 99211 11 24 52.92 −17 41 02.4 -98.7 3.4 TYC A029 CCDM 11249-1741 B 11 24 53.29 −17 41 02.8 -100.0 3.0 CCDM 5.3 A030 P HD 177724 19 05 24.60 +13 51 48.5 -7.3 -96.0 TDSC A030 CCDM 19055+1352 B 19 05 24.96 +13 51 52.4 -7.3 -96.0 TDSC,CCDM 6.5 A031 P HD 157792 17 26 22.21 −24 10 31.1 -1.4 -117.3 TYC2 A032 P HD 103287 11 53 49.84 +53 41 41.1 103.3 10.3 TYC2 A033 P CCDM 02449+1007 A 02 44 56.54 +10 06 50.9 285.0 -31.2 NLTT A033 CCDM 02449+1007 B 02 44 56.54 +10 06 50.9 285.0 -31.2 NLTT A034 P HD 165777 18 07 20.98 +09 33 49.9 -59.1 80.1 TRC A034 GJ 9615 B 18 07 19.48 +09 34 02.2 -59.1 80.1 TRC,CCDM 25.4 A035 P HD 108767 12 29 51.86 −16 30 55.6 -210.0 -139.3 NLTT A035 NLTT 30916 12 29 50.90 −16 31 15.0 -210.0 -139.3 NLTT 23.8 A036 P CCDM 19026-2953 A 19 02 36.69 −29 52 48.4 -17.8 -2.4 TRC A036 CCDM 19026-2953 B 19 02 36.69 −29 52 48.4 -17.8 -2.4 TRC A037 P HD 155125 17 10 22.68 −15 43 30.1 38.6 57.7 TRC A037 GJ 656.1 B 17 10 22.68 −15 43 30.1 38.6 57.7 TRC,CCDM A038 P HD 18978 03 02 23.50 −23 37 27.9 -141.3 -38.4 TRC A039 P HD 180777 19 09 09.87 +76 33 37.8 49.4 -120.0 TYC2 A040 P HD 33111 05 07 50.98 −05 05 11.2 -84.4 -75.3 TYC A041 P HD 210418 22 10 11.98 +06 11 52.3 282.0 31.2 NLTT A042 P HD 87696 10 07 25.76 +35 14 40.9 51.0 1.1 TYC2 A043 P HD 172555 18 45 26.90 −64 52 16.5 32.9 -148.2 TYC2 A043 TYC 9077-2489-1 18 45 37.03 −64 51 46.1 28.0 -161.0 PPM 71.3 A044 P HD 70060 08 18 33.31 −36 39 33.4 -110.0 99.9 TYC2 A045 P HD 78209 09 08 52.26 +51 36 16.7 -136.1 -32.7 TYC A046 P HD 173880 18 47 01.27 +18 10 53.5 72.3 117.4 TDSC A047 P HD 27045 04 17 15.66 +20 34 42.9 -39.5 -61.7 TDSC A047 HD 284336 04 17 26.94 +20 33 17.5 -43.5 -60.0 TRC 179.9 A048 P HD 125161 14 16 09.93 +51 22 02.0 -150.2 89.5 NLTT A048 HD 234121 14 16 12.18 +51 22 34.6 -142.4 92.0 NLTT 38.7 A049 P HD 50241 06 48 11.46 −61 56 28.7 -66.7 272.0 NLTT A050 P HD 209790 22 03 47.45 +64 37 40.7 213.9 88.6 NLTT A050 HD 209791 22 03 46.22 +64 37 41.5 201.7 85.9 NLTT 8.0 A051 P HD 202730 21 19 51.99 −53 26 58.0 112.6 -73.2 TYC A051 GJ 9733 B 21 19 51.22 −53 26 57.8 92.0 -78.2 TDSC 6.9 A052 P HD 159560 17 32 16.03 +55 10 22.6 146.2 54.8 TRC A052 HD 159541 17 32 10.58 +55 11 03.3 152.6 57.6 TRC 61.9 A053 P HD 125162 14 16 23.02 +46 05 17.9 -186.7 159.1 NLTT A054 P HD 8538 01 25 48.95 +60 14 07.0 297.2 -49.5 NLTT A055 P HD 135379 15 17 30.86 −58 48 04.4 -93.2 -135.6 TRC A056 P HD 56537 07 18 05.58 +16 32 25.4 -45.9 -37.1 TDSC A056 GJ 9231 B 07 18 05.96 +16 32 33.4 -45.0 -39.0 CCDM 9.7 A057 P HD 88955 10 14 44.15 −42 07 19.0 -150.6 50.9 TYC2 A058 P HD 213558 22 31 17.51 +50 16 56.9 149.0 6.1 TRC Continued on next page...

32 N. M. Phillips et al.

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

A059 P HD 161868 17 47 53.56 +02 42 26.2 -23.2 -74.9 TYC2 A060 P HD 47105 06 37 42.71 +16 23 57.3 5.2 -63.2 TYC A061 P HD 188228 20 00 35.55 −72 54 37.8 79.9 -131.6 TYC2 A062 P HD 83446 09 36 49.54 −49 21 18.1 -131.5 38.2 TDSC A063 P HD 222603 23 42 02.81 +01 46 48.1 -129.5 -155.1 NLTT A064 P HD 20320 03 15 50.02 −08 49 11.0 -3.7 45.2 TYC2 A065 P CCDM 15278+2906 A 15 27 49.73 +29 06 20.5 -181.5 85.2 TDSC A065 CCDM 15278+2906 B 15 27 49.73 +29 06 20.5 -181.5 85.2 TDSC A066 P HD 104513 12 02 06.80 +43 02 44.3 -326.5 71.7 NLTT A067 P HD 14055 02 17 18.87 +33 50 49.9 44.8 -53.0 TYC2 A068 P HD 91312 10 33 13.89 +40 25 32.0 -141.1 6.0 TDSC A069 P HD 112413 12 56 01.67 +38 19 06.2 -233.4 55.0 NLTT A069 HD 112412 12 56 00.45 +38 18 53.7 -203.9 88.3 NLTT 19.0 A070 P HD 12111 02 01 57.44 +70 54 25.4 -63.5 9.2 TDSC A070 TYC 4315-2126-2 02 01 57.28 +70 54 24.9 -63.5 9.2 TDSC A070 CCDM 02020+7054 C 02 02 01.19 +70 54 40.4 -63.5 9.2 TDSC,CCDM 23.7 A071 P HD 109536 12 35 45.53 −41 01 19.0 -107.6 1.1 TYC2 A072 P HD 31295 04 54 53.73 +10 09 03.0 40.8 -128.9 TDSC A073 P HD 16754 02 39 48.00 −42 53 30.1 103.6 -23.2 TDSC A073 CCDM 02398-4254 B 02 39 48.19 −42 53 06.4 103.6 -23.2 TDSC,CCDM 23.8 A074 P HD 79439 09 16 11.33 +54 01 18.7 49.4 60.0 TYC2 A075 P HD 25490 04 03 09.38 +05 59 21.5 4.5 -2.3 TYC2 A076 P HD 110411 12 41 53.06 +10 14 08.3 81.9 -89.2 TYC2 A077 P HD 17093 02 44 57.58 +12 26 44.7 123.6 -85.0 TYC2 A078 P HD 184006 19 29 42.36 +51 43 47.2 20.6 129.6 TYC2 A079 P HD 102124 11 45 17.04 +08 15 29.2 59.2 -23.1 TYC2 A080 P HD 177196 19 01 26.37 +46 56 05.4 19.6 -81.8 TDSC A081 P HD 44769 06 23 46.09 +04 35 34.3 -16.9 11.8 TDSC A081 HD 44770 06 23 46.50 +04 35 44.9 6.7 -22.3 TDSC 12.3 A082 P HD 71155 08 25 39.63 −03 54 23.1 -68.7 -26.4 TYC A083 P HD 80081 09 18 50.60 +36 48 09.0 -36.0 -120.0 PPM A083 TYC 2499-1655-2 09 18 50.42 +36 48 07.2 -36.0 -120.0 PPM,CCDM 2.8 A084 P HD 78045 09 02 26.80 −66 23 45.8 -2.6 -91.6 TYC2 A085 P HD 178253 19 09 28.34 −37 54 16.1 85.3 -98.2 TYC2 A086 P HD 13161 02 09 32.63 +34 59 14.3 148.3 -39.9 TDSC A087 P HD 95608 11 02 19.78 +20 10 47.4 -8.0 38.4 TYC2 A088 P HD 102249 11 45 36.42 −66 43 43.5 -97.8 33.5 TDSC A089 P HD 215789 22 48 33.30 −51 19 00.8 108.0 -70.8 TYC2 A090 P HD 5448 00 56 45.20 +38 29 57.4 131.0 14.9 TRC A091 P HD 137898 15 28 38.24 +01 50 31.5 -84.3 -32.4 TYC2 A092 P HD 165040 18 08 34.81 −63 40 06.7 17.2 -201.0 TYC2 A093 P HD 110304 12 41 31.03 −48 57 35.7 -193.6 -11.6 NLTT A093 TYC 8240-2724-2 12 41 31.01 −48 57 34.5 -193.6 -11.6 NLTT 1.2 A093 SCR 1240-4904 12 40 56.79 −49 04 01.9 -199.0 -2.1 SCR 512.5 A094 P HD 49434 06 48 19.07 −01 19 08.1 -36.7 -34.2 TYC2 A095 P HD 109787 12 37 42.17 −48 32 28.7 -185.1 -6.8 NLTT A096 P HD 154494 17 05 22.69 +12 44 27.0 50.8 -11.7 TDSC A097 P CCDM 16278-0822 A 16 27 48.18 −08 22 18.0 -78.7 11.6 TDSC A097 CCDM 16278-0822 B 16 27 48.18 −08 22 18.0 -78.7 11.6 TDSC A097 HD 148300 16 27 28.92 −08 34 19.1 -84.0 10.6 TYC2 775.7 A097 TYC 5626-1249-1 16 27 22.38 −08 27 58.8 -70.0 -9.4 TYC2 512.6 A098 P HD 85376 09 51 53.03 +24 23 43.3 10.1 -176.8 TYC2 A099 P HD 6961 01 11 06.16 +55 08 59.6 226.6 -19.3 NLTT A100 P HD 198639 20 50 04.93 +44 03 33.5 122.8 133.2 TDSC A101 P HD 130109 14 46 14.92 +01 53 34.4 -116.6 -23.1 TYC2 A102 P HD 146624 16 18 17.90 −28 36 50.5 -32.4 -100.2 TYC2 A103 P HD 1404 00 18 19.66 +36 47 06.8 -65.2 -42.3 TYC2 A104 P HD 90132 10 23 29.29 −38 00 35.4 -160.4 -54.0 NLTT A105 P HD 19107 03 04 16.52 −07 36 03.1 65.7 17.5 TYC2 A106 P HD 210049 22 08 23.01 −32 59 18.5 77.3 -28.0 TYC2 A107 P HD 165189 18 06 49.89 −43 25 30.8 13.8 -105.3 TDSC A107 HD 165190 18 06 49.92 −43 25 29.1 13.8 -105.3 TDSC 1.7 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 33

Table 4. Component names, positions and proper motions (continued)

UNS ID Primary Name Position ICRS 2000.0 μ_α cos δ μ_δ References ρ (mas/yr) (mas/yr) (arcsec)

A108 P HD 46304 06 32 23.13 −05 52 07.7 -0.1 -41.2 TDSC A108 CCDM 06324-0552 B 06 32 23.41 −05 52 08.1 -0.1 -41.2 TDSC,CCDM 4.2 A109 P HD 223352 23 48 55.55 −28 07 49.0 99.9 -104.3 TDSC A109 CCDM 23489-2808 B 23 48 55.55 −28 07 49.0 99.9 -104.3 TDSC A109 HD 223340 23 48 50.50 −28 07 15.7 101.2 -104.7 TRC 74.6 A110 P HD 89021 10 17 05.79 +42 54 51.7 -168.9 -39.0 TRC A111 P HD 123998 14 18 13.89 −81 00 27.9 -20.7 -65.5 TYC2 A112 P HD 15089 02 29 03.96 +67 24 08.7 -18.0 11.8 TDSC A112 TYC 4058-1504-2 02 29 03.57 +67 24 07.0 -18.0 11.8 TDSC 2.8 A112 TYC 4058-1505-1 02 29 05.12 +67 24 05.7 -18.0 11.8 TDSC,CCDM 7.3 A113 P HD 23281 03 43 33.84 −10 29 08.4 -4.7 -20.7 TYC2 A114 P HD 28527 04 30 33.63 +16 11 38.5 104.7 -25.1 TDSC A114 HD 28568 04 30 46.80 +16 08 55.3 104.0 -26.5 TDSC 250.2 A115 P HD 37594 05 39 31.15 −03 33 53.0 -2.2 1.0 TYC2 A116 P HD 192640 20 14 32.04 +36 48 22.7 68.9 71.8 TDSC A117 P HD 197950 20 43 11.02 +66 39 26.8 26.9 34.6 TYC2 A118 P HD 15008 02 21 44.94 −68 39 33.9 -49.2 1.4 TYC2 A119 P HD 212728 22 28 37.67 −67 29 20.6 150.8 -70.9 TYC2 A120 P HD 186219 19 49 25.31 −72 30 12.2 7.0 15.4 TYC2 A121 P HD 222345 23 39 47.07 −14 13 19.8 50.3 -51.6 TYC2 A122 P HD 48097 06 42 24.33 +17 38 43.1 8.7 -84.5 TYC2 A123 P HD 213398 22 31 30.33 −32 20 45.9 60.7 -20.7 TDSC A123 TYC 7497-1512-1 22 31 30.64 −32 21 15.9 55.4 -20.3 TDSC 30.3 A124 P CCDM 16035-5747 A 16 03 32.09 −57 46 30.2 -116.1 -78.6 TDSC A124 CCDM 16035-5747 B 16 03 32.09 −57 46 30.2 -116.1 -78.6 TDSC A124 TYC 8718-2861-1 16 03 30.85 −57 46 35.4 -133.7 -106.4 TYC 11.3 A125 P HD 159492 17 38 05.52 −54 30 01.6 -49.8 -149.9 TYC2 A126 P HD 37507 05 38 53.08 −07 12 46.2 -14.1 -50.6 TYC2 A127 P HD 140436 15 42 44.57 +26 17 44.3 -107.0 47.8 TDSC A127 TYC 2036-1674-2 15 42 44.60 +26 17 44.0 -107.0 47.8 TDSC A128 P HD 141296 15 50 16.31 −45 24 06.2 39.9 -32.4 TDSC A128 CCDM 15503-4524 B 15 50 16.33 −45 24 09.1 39.9 -32.4 TDSC,CCDM 2.9 A128 CCDM 15503-4524 C 15 50 16.27 −45 24 08.8 39.9 -32.4 TDSC,CCDM 2.6 A129 P HD 28546 04 30 38.89 +15 41 30.7 104.6 -26.6 TDSC A129 HD 28485 04 30 08.60 +15 38 16.2 110.6 -28.3 TDSC 478.8 A129 TYC 1265-1175-2 04 30 08.64 +15 38 17.8 110.6 -28.3 TDSC 477.7 A129 HD 28545 04 30 34.88 +15 44 02.3 99.6 -21.7 TDSC 162.3 A130 P HD 16555 02 37 24.36 −52 32 35.2 95.8 -14.7 TYC2

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures: spectral type and reference; Tycho B_T,V_T magnitudes with standard errors and reference; T_{eff} from gray03 or gray06; T_{eff} computed from Tycho photometry (see text). Where TYC2 and TDSC give the same B_T,V_T and uncertainties we use TYC2 as the reference here. In six cases Tycho photometry is not available, so we give values converted from Johnson B,V magnitudes using V_T = V_J +^{0.090}_{0.850} (B_J − V_J), B_T = V_J +^{1.090}_{0.850} (B_J − V_J).

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

K001 HD 22049 K2 V (k) gray06 3.814 ± 0.009 4.846 ± 0.014 TYC2 4999 5005 K002 HD 201091 K5 V gray03 5.349 ± 0.009 6.711 ± 0.014 TYC2 4401 K003 HD 209100 K4 V (k) gray06 4.826 ± 0.009 6.048 ± 0.014 TYC2 4654 K004 HD 202560 K7.0 haw96 6.845 ± 0.011 8.476 ± 0.017 TYC2 3915 K005 HD 88230 K5 haw95 6.751 ± 0.010 8.340 ± 0.016 TYC2 3990 K006 HD 26965 K0.5 V gray06 4.506 ± 0.009 5.440 ± 0.014 TYC2 5124 5199 K007 HD 165341 K0- V gray03 4.217 ± 0.009 5.180 ± 0.014 TYC2 5019 5140 K008 HD 131977 K4 V gray06 5.880 ± 0.010 7.163 ± 0.016 TYC2 4544 K009 HD 155886 K1.5 V (k) gray06 5.119 ± 0.009 6.097 ± 0.015 TYC2 5110 K010 HD 191408 K2.5 V gray06 5.413 ± 0.009 6.391 ± 0.014 TYC2 4857 5110 K011 HD 79210 K7 haw95 7.789 ± 0.012 9.412 ± 0.022 TYC2 3930 K012 HD 191849 K7.0 haw96 8.174 ± 0.013 9.798 ± 0.025 TYC2 3928 K013 HD 219134 K3 V gray03 5.674 ± 0.009 6.861 ± 0.015 TYC2 4798 4718 Continued on next page...

34 N. M. Phillips et al.

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

K014 HD 16160 K3 V gray06 5.928 ± 0.010 7.063 ± 0.016 TYC2 4726 4813 K015 HD 156384 K4- V gray06 6.366 ± 0.010 7.521 ± 0.016 TYC2 4776 K016 HD 4628 K2.5 V gray06 5.828 ± 0.010 6.855 ± 0.015 TYC2 4916 5015 K017 HD 10476 K1 V gray06 5.337 ± 0.010 6.300 ± 0.015 TYC2 5155 5140 K018 HD 6582 K1 V Fe-2 gray03 5.230 ± 0.009 5.988 ± 0.014 TYC2 5526 5595 K019 HD 216803 K4+ V k gray06 6.601 ± 0.010 7.896 ± 0.016 TYC2 4522 K020 HD 10361 K2 V gray06 5.781 ± 0.009 6.765 ± 0.015 TYC2 5099 K021 HD 157881 K5 haw95 7.705 ± 0.011 9.318 ± 0.019 TYC2 3947 K022 HD 217357 K5 haw95 8.047 ± 0.013 9.628 ± 0.025 TYC2 4005 K023 HD 32450 K7 haw95 8.660 ± 0.010 10.350 ± 0.030 TDSC 3812 K024 HD 32147 K3+ V gray03 6.346 ± 0.010 7.613 ± 0.016 TYC2 4740 4573 K025 HD 50281 K3.5 V gray03 6.705 ± 0.010 7.968 ± 0.016 TYC2 4572 4580 K026 HD 156274 G8/K0 V houk 5.608 ± 0.009 6.501 ± 0.015 TYC2 5285 K027 HD 192310 K2+ V gray06 5.824 ± 0.009 6.860 ± 0.014 TYC2 5015 4998 K028 HD 103095 K1 V Fe-1.5 gray03 6.509 ± 0.010 7.353 ± 0.015 TYC2 5157 5392 K029 HD 100623 K0- V gray06 6.049 ± 0.009 6.962 ± 0.015 TYC2 5141 5242 K030 HD 149661 K0 V (k) gray06 5.854 ± 0.009 6.815 ± 0.015 TYC2 5224 5144 K031 HD 151288 K5 haw95 8.253 ± 0.012 9.830 ± 0.022 TYC2 4012 K032 HD 122064 K3V BSC5 6.611 ± 0.010 7.832 ± 0.015 TYC2 4656 K033 HD 232979 K7 haw95 8.804 ± 0.013 10.421 ± 0.029 TYC2 3940 K034 HD 103932 K4+ V gray06 7.111 ± 0.010 8.449 ± 0.016 TYC2 4445 K035 HD 17925 K1.5 V (k) gray06 6.145 ± 0.010 7.162 ± 0.016 TYC2 5056 5034 K036 HD 111631 K7 haw95 8.651 ± 0.015 10.279 ± 0.032 TYC2 3921 K037 HD 154363 K4/5 V houk 7.860 ± 0.012 9.219 ± 0.020 TYC2 4407 K038 HD 13445 K1 V gray06 6.209 ± 0.010 7.148 ± 0.015 TYC2 5129 5189 K039 HD 147379 K7 haw95 8.772 ± 0.015 10.347 ± 0.031 TYC2 4015 K040 HD 223778 K3 V gray03 6.489 ± 0.010 7.612 ± 0.015 TYC2 4715 4835 K041 HIP 66459 K5 haw95 9.186 ± 0.016 10.858 ± 0.041 TYC2 3843 K042 HD 160346 K2.5 V gray03 6.632 ± 0.010 7.750 ± 0.015 TYC2 4801 4844 K043 HD 11507 K7 haw95 9.101 ± 0.016 10.774 ± 0.041 TYC2 3842 K044 HD 166620 K2 V gray03 6.483 ± 0.010 7.508 ± 0.015 TYC2 4900 5019 K045 HD 3651 K0 V gray03 5.973 ± 0.010 6.961 ± 0.015 TYC2 5280 5091 K046 HD 115404 K2.5 V (k) gray03 6.656 ± 0.010 7.687 ± 0.015 TYC2 4899 5007 K047 HD 74576 K2.5 V (k) gray06 6.680 ± 0.009 7.766 ± 0.015 TYC2 4925 4904 K048 HD 85512 K6 V (k) gray06 7.803 ± 0.010 9.159 ± 0.017 TYC2 4412 K049 HD 75632 K5 haw95 8.820 ± 0.010 10.380 ± 0.030 TDSC 4042 K050 GJ 4 A K7 haw95 8.981 ± 0.013 10.586 ± 0.030 TYC2 3962 K051 HD 245409 K7 haw95 9.018 ± 0.021 10.651 ± 0.054 TYC2 3912 K052 HD 222237 K3+ V gray06 7.209 ± 0.010 8.370 ± 0.016 TYC2 4615 4765 K053 HD 131511 K0 V gray03 6.090 ± 0.010 7.052 ± 0.015 TYC2 5250 5142 K054 HD 125072 K3 IV gray06 6.772 ± 0.010 7.982 ± 0.016 TYC2 4903 4676 K055 CCDM 15009+4526 A K7 haw95 9.323 ± 0.018 11.009 ± 0.047 TYC2 3819 K056 HD 97101 K7 V gray03 8.506 ± 0.015 10.095 ± 0.031 TYC2 3990 K057 HD 196877 K5.0 haw96 8.995 ± 0.016 10.573 ± 0.035 TYC2 4010 K058 HD 37394 K0 V gray03 6.294 ± 0.010 7.271 ± 0.015 TYC2 5264 5112 K059 HD 101581 K4.5 V (k) gray06 7.918 ± 0.011 9.157 ± 0.017 TYC2 4624 K060 HD 75732 K0 IV-V gray03 6.036 ± 0.009 7.037 ± 0.015 TYC2 4999 5065 K061 HD 21531 K6 V k gray06 8.556 ± 0.014 10.069 ± 0.028 TYC2 4127 K062 HD 158633 K0V BSC5 6.510 ± 0.010 7.377 ± 0.015 TYC2 5341 K063 HD 190007 K4 V (k) gray06 7.611 ± 0.011 8.925 ± 0.018 TYC2 4488 K064 HD 82106 K3 V gray03 7.330 ± 0.012 8.506 ± 0.018 TYC2 4709 4738 K065 HD 40307 K2.5 V gray06 7.256 ± 0.010 8.360 ± 0.016 TYC2 4775 4870 K066 HD 36003 K5- V gray06 7.791 ± 0.011 9.143 ± 0.018 TYC2 4419 K067 HD 27274 K4.5 V (k) gray06 7.769 ± 0.011 9.077 ± 0.017 TYC2 4499 K068 HD 166348 K6 V (k) gray06 8.516 ± 0.013 10.030 ± 0.027 TYC2 4126 K069 HD 98712 K6 V ke gray06 8.877 ± 0.015 10.364 ± 0.029 TYC2 4175 K070 HIP 67090 K5 haw95 10.012 ± 0.028 11.608 ± 0.068 TYC2 3978 K071 HD 29697 K4 V ke gray03 8.250 ± 0.014 9.553 ± 0.024 TYC2 4508 K072 HD 128165 K3V HIP 7.361 ± 0.010 8.519 ± 0.016 TYC2 4771 K073 HD 170657 K2 V gray06 6.901 ± 0.011 7.897 ± 0.016 TYC2 5075 K074 HD 120476 K3.5 V gray03 7.357 ± 0.009 8.667 ± 0.014 TYC 4495 K075 GJ 428 A K5- V gray06 7.676 ± 0.012 9.130 ± 0.020 TYC2 4234 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 35

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

K076 HD 211970 K5.0 haw96 9.160 ± 0.016 10.767 ± 0.039 TYC2 3958 K077 HD 214749 K4.5 V k gray06 7.965 ± 0.012 9.338 ± 0.020 TYC2 4381 K078 HD 10436 K5.5 V gray03 8.542 ± 0.012 9.957 ± 0.021 TYC2 4305 K079 HD 22496 K5.0 haw96 8.732 ± 0.013 10.299 ± 0.028 TYC2 4030 K080 HD 154577 K2.5 V (k) gray06 7.494 ± 0.010 8.532 ± 0.016 TYC2 4850 4994 K081 HIP 61094 K7 haw95 9.861 ± 0.029 11.478 ± 0.071 TYC2 3940 K082 HIP 27188 K7 haw95 9.188 ± 0.016 10.805 ± 0.038 TYC2 3940 K083 HIP 42220 K7 haw95 9.467 ± 0.013 11.118 ± 0.028 TYC2 3880 K084 HD 145417 K3 V Fe-1.7 gray06 7.628 ± 0.010 8.563 ± 0.016 TYC2 4954 5197 K085 HD 184489 K5 haw95 9.505 ± 0.022 10.919 ± 0.048 TYC2 4307 K086 GJ 400 A K7 haw95 9.447 ± 0.022 11.173 ± 0.060 TYC2 3751 K087 HD 23356 K2.5 V gray06 7.190 ± 0.011 8.282 ± 0.016 TYC2 4892 K088 HD 216133 K7 haw95 10.082 ± 0.036 11.675 ± 0.081 TYC2 3983 K089 HD 5133 K2.5 V (k) gray06 7.290 ± 0.011 8.338 ± 0.017 TYC2 4822 4975 K090 HD 61606 K3- V gray03 7.296 ± 0.010 8.419 ± 0.016 TYC2 4908 4835 K091 HD 234078 K5 haw95 8.977 ± 0.015 10.521 ± 0.033 TYC2 4071 K092 HD 110315 K4.5 V gray03 8.049 ± 0.012 9.338 ± 0.020 TYC2 4533 K093 HD 173818 K5 haw95 8.992 ± 0.018 10.458 ± 0.040 TYC2 4213 K094 HD 150689 K3+ V (k) gray06 7.646 ± 0.013 8.879 ± 0.020 TYC2 4694 4635 K095 HD 120467 K5.5 V (k) gray06 8.352 ± 0.013 9.817 ± 0.026 TYC2 4214 K096 HIP 70218 K6 V gray03 8.697 ± 0.014 10.169 ± 0.027 TYC2 4202 K097 HIP 44722 K7 haw95 9.728 ± 0.034 11.599 ± 0.098 TYC2 3522 K098 HD 144579 K0 V Fe-1.2 gray03 6.735 ± 0.010 7.567 ± 0.015 TYC2 5280 5419 K099 HIP 37288 K7 haw95 9.818 ± 0.025 11.494 ± 0.066 TYC2 3836 K100 HD 57095 K2.5 V (k) gray06 7.100 ± 0.011 8.145 ± 0.017 TYC2 4981 K101 HD 205390 K1.5 V gray06 7.239 ± 0.010 8.269 ± 0.016 TYC2 4971 5009 K102 HD 97584 K5 CCDM 7.768 ± 0.011 8.990 ± 0.017 TYC2 4654 K103 HD 120036 K6.5 V (k) gray06 8.986 ± 0.016 10.471 ± 0.036 TYC2 4178 K104 HD 52698 K1 V (k) gray06 6.802 ± 0.010 7.828 ± 0.014 TYC2 5017 K105 HD 144628 K1 V gray06 7.214 ± 0.011 8.189 ± 0.017 TYC2 5011 5116 K106 HD 142709 K5- V gray06 8.194 ± 0.012 9.474 ± 0.020 TYC2 4550 K107 HD 19305 K5 haw95 9.234 ± 0.019 10.871 ± 0.047 TYC2 3905 K108 HIP 13375 K5 haw95 9.731 ± 0.032 11.226 ± 0.071 TYC2 4160 K109 HD 118926 K5 haw95 9.799 ± 0.030 11.435 ± 0.075 TYC2 3907 K110 HD 45088 K3 V k gray03 6.915 ± 0.011 8.040 ± 0.017 TYC2 4647 4831 K111 HD 110833 K3 CCDM 7.118 ± 0.010 8.222 ± 0.015 TYC2 4870 K112 HD 221503 K5 haw95 8.763 ± 0.018 10.256 ± 0.036 TYC2 4164 K113 HIP 5247 K5 haw95 9.161 ± 0.016 10.655 ± 0.037 TYC2 4162 K114 HD 218511 K5.5 V (k) gray06 8.444 ± 0.013 9.856 ± 0.022 TYC2 4311 K115 HIP 1368 K7 haw95 9.150 ± 0.017 10.713 ± 0.038 TYC2 4037 K116 HD 200779 K6 V gray03 8.491 ± 0.019 9.853 ± 0.036 TYC2 4401 K117 HD 36705 K2 V k gray06 7.030 ± 0.010 7.971 ± 0.016 TYC2 5041 5185 K118 HD 224953 K5.0 haw96 9.713 ± 0.022 11.175 ± 0.047 TYC2 4220 K119 TYC 8112-1978-1 K7.0 haw96 9.903 ± 0.030 11.586 ± 0.073 TYC2 3824 K120 HD 34673 K3 V gray03 7.967 ± 0.012 9.163 ± 0.019 TYC2 4702 K121 GJ 319 A K7 haw95 9.780 ± 0.028 11.454 ± 0.072 TYC2 3840 K122 HD 21197 K4 V gray03 8.001 ± 0.012 9.367 ± 0.020 TYC2 4394 K123 HD 24916 K4 V gray03 8.212 ± 0.014 9.536 ± 0.023 TYC2 4470 K124 HIP 18280 K7 haw95 9.208 ± 0.023 10.853 ± 0.062 TYC2 3891 K125 GJ 750 A K7.0 haw96 9.587 ± 0.022 11.293 ± 0.057 TYC2 3785 K126 HD 139763 K6 V k gray06 9.096 ± 0.022 10.631 ± 0.052 TYC2 4088 K127 HD 4967 K5 haw95 9.125 ± 0.018 10.666 ± 0.039 TYC2 4077

G001 HD 128620 G2 V gray06 -0.065 ± 0.707 ± bes90 5560 G002 HD 10700 G8.5 V gray06 3.572 ± 0.009 4.380 ± 0.014 TYC2 5358 5474 G003 HD 185144 G9 V gray03 4.757 ± 0.009 5.657 ± 0.014 TYC2 5210 5270 G004 HD 4614 G0V SB HIP 3.518 ± 0.009 4.142 ± 0.014 TYC2 5968 G005 HD 20794 G8 V gray06 4.336 ± 0.009 5.130 ± 0.014 TYC2 5478 5507 G006 HD 131156 G7 V gray03 4.757 ± 0.009 5.575 ± 0.014 TYC2 5380 5451 G007 CCDM 12337+4121 A G0 V gray03 4.309 ± 0.009 4.955 ± 0.014 TYC2 5818 5901 G008 HD 115617 G7 V gray06 4.810 ± 0.009 5.612 ± 0.014 TYC2 5503 5488 G009 HD 39587 G0 V CH-0.3 gray06 4.462 ± 0.009 5.103 ± 0.014 TYC2 5951 5916 Continued on next page...

36 N. M. Phillips et al.

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

G010 HD 114710 G0V HIP 4.304 ± 0.009 4.946 ± 0.014 TYC2 5913 G011 HD 20630 G5 V houk 4.919 ± 0.009 5.670 ± 0.014 TYC2 5613 G012 HD 102365 G2 V gray06 4.962 ± 0.009 5.697 ± 0.014 TYC2 5688 5654 G013 HD 101501 G8 V gray03 5.390 ± 0.009 6.217 ± 0.014 TYC2 5463 5430 G014 HD 10780 G9 V gray03 5.710 ± 0.009 6.612 ± 0.014 TYC2 5312 5265 G015 HD 43834 G7 V gray06 5.151 ± 0.009 5.968 ± 0.014 TYC2 5500 5453 G016 HD 13974 G0V HIP 4.933 ± 0.009 5.597 ± 0.014 TYC2 5849 G017 HD 82885 G8+ V gray03 5.478 ± 0.009 6.349 ± 0.014 TYC2 5370 5332 G018 HD 20807 G0 V gray06 5.296 ± 0.009 5.940 ± 0.014 TYC2 5848 5907 G019 HD 141004 G0 IV-V gray03 4.482 ± 0.009 5.138 ± 0.014 TYC2 5892 5872 G020 HD 224930 G5 V Fe-1 gray03 5.834 ± 0.009 6.555 ± 0.014 TYC2 5502 5691 G021 HD 72673 G9 V gray06 6.462 ± 0.009 7.356 ± 0.014 TYC2 5272 5282 G022 HD 69830 G8+ V gray06 6.030 ± 0.009 6.905 ± 0.015 TYC2 5447 5323 G023 HD 34411 G1 V gray03 4.761 ± 0.009 5.438 ± 0.014 TYC2 5857 5811 G024 HD 14412 G8 V gray06 6.414 ± 0.010 7.241 ± 0.015 TYC2 5423 5430 G025 HD 133640 G2V + G2V HIP 5.203 ± 0.009 5.846 ± 0.014 TYC2 5910 G026 CCDM 01418+4237 A G1 V gray03 5.027 ± 0.009 5.703 ± 0.014 TYC2 5874 5814 G027 HIP 80300 DA HIP 11.003 ± 0.077 10.780 ± 0.045 TYC2 12382 G028 HD 172051 G6 V gray06 5.935 ± 0.010 6.666 ± 0.015 TYC2 5601 5664 G029 HD 30495 G1.5 V CH-0.5 gray06 5.558 ± 0.009 6.250 ± 0.014 TYC2 5758 5769 G030 HD 166 G8 V gray03 6.145 ± 0.010 7.000 ± 0.015 TYC2 5412 5367 G031 HD 211415 G0 V gray06 5.459 ± 0.009 6.107 ± 0.014 TYC2 5837 5896 G032 HD 146233 G2 V gray03 5.570 ± 0.009 6.292 ± 0.015 TYC2 5744 5688 G033 HD 95128 G0V HIP 5.102 ± 0.009 5.780 ± 0.014 TYC2 5808 G034 HD 160269 G0V HIP 5.281 ± 0.009 5.927 ± 0.014 TYC2 5901 G035 HD 157214 G0V BSC5 5.453 ± 0.009 6.126 ± 0.014 TYC2 5823 G036 HD 72905 G1.5Vb BSC5 5.702 ± 0.009 6.376 ± 0.014 TYC2 5820 G037 HD 196761 G8 V gray06 6.438 ± 0.010 7.256 ± 0.015 TYC2 5489 5451 G038 HD 140538 G3 V houk 5.945 ± 0.010 6.698 ± 0.014 TYC2 5608 G039 HD 136352 G2- V gray06 5.721 ± 0.009 6.421 ± 0.015 TYC2 5746 5747 G040 HD 86728 G4 V gray03 5.451 ± 0.009 6.196 ± 0.014 TYC2 5720 5628 G041 HD 4391 G5 V Fe-0.8 gray06 5.865 ± 0.009 6.556 ± 0.014 TYC2 5772 5772 G042 HD 38858 G2 V gray03 6.037 ± 0.010 6.724 ± 0.015 TYC2 5744 5783 G043 HD 140901 G7 IV-V gray06 6.083 ± 0.009 6.884 ± 0.015 TYC2 5500 5491 G044 GJ 25 A G7 V gray06 6.200 ± 0.010 6.970 ± 0.010 TDSC 5480 5565 G045 HD 41593 G9 V gray03 6.844 ± 0.010 7.787 ± 0.016 TYC2 5181 G046 GJ 188 A G1 V gray03 4.986 ± 0.009 5.699 ± 0.014 TYC2 5592 5712 G047 HD 160691 G3 IV-V gray06 5.197 ± 0.009 5.964 ± 0.014 TYC2 5748 5573 G048 HD 217014 G2 V+ gray06 5.526 ± 0.009 6.249 ± 0.014 TYC2 5750 5685 G049 HD 182488 G9+ V gray03 6.447 ± 0.010 7.374 ± 0.015 TYC2 5352 5213 G050 HD 116442 G9 V gray03 7.125 ± 0.010 8.046 ± 0.016 TYC2 5350 5226 G051 HD 190360 G7 IV-V gray06 5.811 ± 0.009 6.661 ± 0.014 TYC2 5497 5378 G052 HD 142373 G0 V Fe-0.8... gray03 4.664 ± 0.009 5.278 ± 0.014 TYC2 5837 6000 G053 HD 207129 G0 V Fe+0.4 gray06 5.636 ± 0.009 6.289 ± 0.014 TYC2 5928 5881 G054 HD 158614 G6 V houk 6.110 ± 0.010 6.900 ± 0.010 TDSC 5517 G055 HD 64096 G0 V gray06 5.610 ± 0.010 6.220 ± 0.010 TDSC 5826 6012 G056 HD 43162 G6.5 V gray06 6.446 ± 0.009 7.230 ± 0.014 TYC2 5571 5531 G057 HD 111395 G7 V gray03 6.368 ± 0.010 7.166 ± 0.015 TYC2 5665 5498 G058 HD 25680 G1 V gray03 5.971 ± 0.010 6.680 ± 0.015 TYC2 5788 5723 G059 HD 53705 G0 V gray06 5.607 ± 0.009 6.280 ± 0.014 TYC2 5775 5823 G060 HD 177565 G6 V gray06 6.226 ± 0.010 7.020 ± 0.015 TYC2 5624 5507 G061 HD 122742 G6 V gray03 6.353 ± 0.010 7.206 ± 0.015 TYC2 5350 5371 G062 HD 62613 G8V BSC5 6.630 ± 0.009 7.448 ± 0.015 TYC2 5451 G063 HD 126053 G1.5 V gray03 6.323 ± 0.010 7.029 ± 0.015 TYC2 5722 5731 G064 HD 143761 G0 V gray03 5.471 ± 0.009 6.130 ± 0.014 TYC2 5775 5863 G065 HD 50692 G0 V gray03 5.816 ± 0.009 6.472 ± 0.015 TYC2 5907 5872 G066 HD 152391 G8.5 V (k) gray06 6.733 ± 0.010 7.594 ± 0.015 TYC2 5422 5354 G067 HD 142267 G0IV HIP 6.149 ± 0.010 6.794 ± 0.015 TYC2 5904 G068 HD 76151 G3 V gray06 6.069 ± 0.009 6.813 ± 0.015 TYC2 5748 5631 G069 HD 102438 G6 V gray06 6.552 ± 0.010 7.329 ± 0.015 TYC2 5528 5548 G070 HD 1237 G8.5 V (k) gray06 6.668 ± 0.010 7.535 ± 0.015 TYC2 5336 5341 G071 HD 165185 G0 V gray06 6.004 ± 0.009 6.657 ± 0.015 TYC2 5906 5881 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 37

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

G072 HD 200968 G9.5 V (k) gray06 7.293 ± 0.010 8.325 ± 0.016 TYC2 5005 G073 HD 115383 G0Vs HIP 5.249 ± 0.009 5.894 ± 0.014 TYC2 5904 G074 HD 193664 G0 V gray03 5.986 ± 0.009 6.630 ± 0.014 TYC2 5932 5907 G075 HD 165499 G0 V gray06 5.535 ± 0.009 6.183 ± 0.014 TYC2 5976 5896 G076 GJ 580 A G9 V gray03 6.667 ± 0.010 7.540 ± 0.016 TYC2 5391 5328 G077 HD 189567 G2 V gray06 6.146 ± 0.010 6.846 ± 0.014 TYC2 5790 5747 G078 HD 190406 G0 V gray06 5.857 ± 0.009 6.521 ± 0.014 TYC2 5913 5849 G079 HD 99491 G6/8 III/IV houk 6.553 ± 0.010 7.477 ± 0.016 TYC2 5220 G080 HD 206860 G0 V CH-0.5 gray06 6.017 ± 0.010 6.658 ± 0.015 TYC2 5954 5916 G081 HD 137107 G2V HIP 5.641 ± 0.009 6.237 ± 0.014 TYC2 6057 G082 HD 42807 G5 V gray03 6.499 ± 0.010 7.241 ± 0.015 TYC2 5617 5636 G083 HD 202940 G7 V gray06 6.727 ± 0.013 7.528 ± 0.019 TYC2 5354 5491 G084 HD 130948 G2V HIP 5.935 ± 0.009 6.583 ± 0.014 TYC2 5896 G085 HD 39091 G0 V gray06 5.721 ± 0.009 6.381 ± 0.014 TYC2 5998 5860 G086 HD 84737 G0 IV-V gray03 5.141 ± 0.009 5.815 ± 0.014 TYC2 5859 5820 G087 HD 222335 G9.5 V gray06 7.262 ± 0.011 8.207 ± 0.016 TYC2 5218 5177 G088 HD 154345 G8V HIP 6.853 ± 0.010 7.686 ± 0.015 TYC2 5416 G089 HD 4747 G9 V gray06 7.226 ± 0.011 8.112 ± 0.016 TYC2 5354 5299 G090 HD 190771 G2 V gray03 6.255 ± 0.009 6.986 ± 0.015 TYC2 5732 5664 G091 HD 181321 G1 V gray06 6.547 ± 0.011 7.237 ± 0.016 TYC2 5810 5775 G092 HD 9540 G8.5 V gray06 7.055 ± 0.011 7.906 ± 0.016 TYC2 5428 5376 G093 HD 52711 G0 V gray03 6.006 ± 0.010 6.654 ± 0.015 TYC2 5847 5896 G094 HD 78366 G0 IV-V gray03 6.001 ± 0.009 6.641 ± 0.015 TYC2 5926 5919 G095 HD 36435 G9 V gray06 7.073 ± 0.010 7.939 ± 0.016 TYC2 5424 5343 G096 HD 43587 G0 V gray06 5.769 ± 0.009 6.425 ± 0.014 TYC2 5861 5872 G097 HD 120690 G5+ V gray06 6.521 ± 0.010 7.291 ± 0.015 TYC2 5535 5565 G098 HD 194640 G8 V gray06 6.697 ± 0.010 7.526 ± 0.015 TYC2 5500 5425 G099 HD 157347 G3 V gray03 6.356 ± 0.010 7.122 ± 0.015 TYC2 5633 5575 G100 HD 79028 G0 IV-V gray03 5.255 ± 0.009 5.902 ± 0.014 TYC2 5871 5899 G101 HD 136923 G9 V gray03 7.239 ± 0.010 8.148 ± 0.016 TYC2 5251 G102 CCDM 22583-0224 A G8 IV-V gray03 6.248 ± 0.010 7.098 ± 0.015 TYC2 5450 5378 G103 HD 128642 G5 CCDM 6.974 ± 0.010 7.834 ± 0.015 TYC2 5356 G104 HD 137763 G9 V gray03 6.948 ± 0.011 7.893 ± 0.016 TYC2 5390 5177 G105 HD 128400 G5 V gray06 6.811 ± 0.010 7.605 ± 0.015 TYC2 5558 5507 G106 HD 180161 G8V HIP 7.116 ± 0.010 8.037 ± 0.016 TYC2 5226 G107 HD 212698 G5 V Fe-0.8 CH-1 gray06 6.293 ± 0.010 6.970 ± 0.016 TYC2 5811 G108 HD 89269 G4 V gray03 6.731 ± 0.010 7.490 ± 0.016 TYC2 5639 5593 G109 GJ 337 A G9 V gray03 6.565 ± 0.010 7.403 ± 0.015 TYC2 5270 5405 G110 HD 203244 G8 V gray06 7.065 ± 0.010 7.885 ± 0.014 TYC2 5445 5446 G111 HD 24496 G7 V gray03 6.905 ± 0.010 7.728 ± 0.016 TYC2 5445 5439 G112 HD 184385 G8 V gray03 6.963 ± 0.010 7.811 ± 0.016 TYC2 5400 5383 G113 HD 212330 G2 IV-V gray06 5.387 ± 0.009 6.129 ± 0.014 TYC2 5744 5636 G114 HD 9407 G6.5 V gray03 6.595 ± 0.009 7.364 ± 0.015 TYC2 5568 G115 HD 18803 G6 V gray03 6.704 ± 0.010 7.491 ± 0.016 TYC2 5588 5524 G116 HD 112758 G9 V gray06 7.627 ± 0.012 8.557 ± 0.018 TYC2 5174 5207 G117 HD 197076 G1 V gray03 6.501 ± 0.010 7.194 ± 0.015 TYC2 5842 5766 G118 HD 1835 G5 V CH-0.5 gray06 6.455 ± 0.010 7.186 ± 0.015 TYC2 5756 5664 G119 HD 76932 G2 V Fe-1.8 CH-1 gray06 5.871 ± 0.009 6.430 ± 0.014 TYC2 6003 6182 G120 HD 186408 G1.5 V gray03 5.997 ± 0.009 6.719 ± 0.014 TYC2 5788 5688 G121 HD 117043 G6V BSC5 6.574 ± 0.009 7.432 ± 0.015 TYC2 5360 G122 HD 146361 G1 IV-V (k) gray03 5.620 ± 0.009 6.262 ± 0.014 TYC2 5913 G123 HD 124580 G0 V gray06 6.373 ± 0.010 7.029 ± 0.015 TYC2 5913 5872 G124 HD 26923 G0 V CH-0.4 gray06 6.377 ± 0.010 7.009 ± 0.016 TYC2 5999 5944 G125 HD 141272 G9 V (k) gray03 7.530 ± 0.012 8.453 ± 0.017 TYC2 5299 5222

F001 HD 61421 F5 IV-V gray03 0.414 ± 0.909 ± bes90 6629 6421 F002 HD 170153 F7Vvar HIP 3.614 ± 0.009 4.150 ± 0.014 TYC2 6263 F003 HD 30652 F6V BSC5 3.222 ± 0.009 3.723 ± 0.014 TYC2 6395 F004 HD 98231 G0V BSC5 4.310 ± 0.010 4.910 ± 0.010 TDSC 6044 F005 HD 1581 F9.5 V gray06 4.286 ± 0.009 4.900 ± 0.014 TYC2 5991 6000 F006 HD 38393 F6.5 V gray06 3.638 ± 0.009 4.162 ± 0.014 TYC2 6372 6307 F007 HD 203608 F9 V Fe-1.4 CH-0.7 gray06 4.276 ± 0.009 4.783 ± 0.014 TYC2 6205 6371 Continued on next page...

38 N. M. Phillips et al.

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

F008 HD 19373 F9.5 V gray03 4.107 ± 0.009 4.759 ± 0.014 TYC2 5899 5884 F009 HD 102870 F9 V houk 3.649 ± 0.009 4.256 ± 0.014 TYC2 6022 F010 GJ 107 A F7V HIP 4.155 ± 0.009 4.685 ± 0.014 TYC2 6285 F011 HD 142860 F6V BSC5 3.882 ± 0.009 4.400 ± 0.014 TYC2 6330 F012 HD 33262 F9 V Fe-0.5 gray06 4.767 ± 0.009 5.320 ± 0.014 TYC2 6246 6203 F013 HD 210027 F5V BSC5 3.809 ± 0.009 4.275 ± 0.014 TYC2 6535 F014 HD 110379 F2 V gray03 3.484 ± 0.009 3.872 ± 0.014 TYC2 6882 F015 HD 207098 kA5hF0mF2 III gray06 2.885 ± 0.009 3.215 ± 0.014 TYC2 7301 7177 F016 HD 147584 F9 V gray06 4.963 ± 0.009 5.561 ± 0.014 TYC2 6107 6051 F017 HD 141891 F1 V gray06 2.851 ± 0.009 3.180 ± 0.014 TYC2 7109 7182 F018 HD 90839 F8 V gray03 4.880 ± 0.009 5.441 ± 0.014 TYC2 6165 6175 F019 HD 82328 F5.5 IV-V gray03 3.214 ± 0.009 3.721 ± 0.014 TYC2 6334 6371 F020 HD 9826 F8V BSC5 4.152 ± 0.009 4.736 ± 0.014 TYC2 6097 F021 HD 222368 F7V BSC5 4.176 ± 0.009 4.718 ± 0.014 TYC2 6242 F022 HD 22484 F8 V houk 4.353 ± 0.009 4.973 ± 0.014 TYC2 5981 F023 HD 20010 F6 V gray06 3.976 ± 0.009 4.510 ± 0.014 TYC2 6258 6271 F024 HD 17206 F6 V gray06 4.521 ± 0.009 5.032 ± 0.014 TYC2 6378 6356 F025 HD 35296 F8 V gray03 5.060 ± 0.009 5.630 ± 0.014 TYC2 6202 6144 F026 HD 126660 F7V BSC5 4.100 ± 0.009 4.630 ± 0.014 TYC2 6285 F027 HD 197692 F5 V gray06 4.172 ± 0.009 4.617 ± 0.014 TYC2 6633 6623 F028 HD 40136 F2 V gray06 3.738 ± 0.009 4.096 ± 0.014 TYC2 7069 7031 F029 HD 176051 G0V HIP 5.360 ± 0.010 5.970 ± 0.010 TDSC 6012 F030 HD 105452 F1 V gray06 4.054 ± 0.009 4.391 ± 0.014 TYC2 7081 7140 F031 HD 84117 F8 V gray06 4.984 ± 0.009 5.543 ± 0.014 TYC2 6205 6182 F032 HD 7570 F9 V Fe+0.4 gray06 5.023 ± 0.009 5.638 ± 0.014 TYC2 6069 5997 F033 HD 63077 F9 V gray06 5.426 ± 0.009 6.024 ± 0.014 TYC2 6002 6051 F034 HD 153597 F6Vvar HIP 4.937 ± 0.009 5.450 ± 0.014 TYC2 6349 F035 HD 182640 F2 IV houk 3.390 ± 0.009 3.738 ± 0.014 TYC2 7082 F036 HD 120136 F7V HIP 4.536 ± 0.009 5.064 ± 0.014 TYC2 6293 F037 HD 165908 F7V BSC5 5.125 ± 0.009 5.672 ± 0.014 TYC2 6224 F038 HD 4813 F7 V gray03 5.224 ± 0.009 5.778 ± 0.014 TYC2 6250 6199 F039 HD 128167 F3Vwvar HIP 4.501 ± 0.009 4.881 ± 0.014 TYC2 6921 F040 GJ 332 A F5 IV-V gray03 4.026 ± 0.009 4.493 ± 0.014 TYC2 6538 6530 F041 HD 65907 F9.5 V gray06 5.643 ± 0.009 6.252 ± 0.014 TYC2 6000 6016 F042 HD 90589 F3 V gray06 4.020 ± 0.009 4.401 ± 0.014 TYC2 6885 6916 F043 HD 215648 F7V HIP 4.251 ± 0.009 4.779 ± 0.014 TYC2 6293 F044 HD 48682 F9 V gray03 5.310 ± 0.009 5.914 ± 0.014 TYC2 6087 6031 F045 HD 55575 F9 V gray03 5.608 ± 0.009 6.233 ± 0.014 TYC2 5866 5965 F046 HD 17051 F9 V Fe+0.3 gray06 5.455 ± 0.009 6.070 ± 0.014 TYC2 6080 5997 F047 HD 177474 F8 V gray06 4.530 ± 0.010 5.070 ± 0.010 TDSC 6202 6249 F048 HD 81997 F5 V houk 4.640 ± 0.009 5.118 ± 0.014 TYC2 6486 F049 HD 156897 F2 V gray06 4.431 ± 0.009 4.822 ± 0.014 TYC2 6704 6868 F050 HD 110897 F9 V Fe-0.3 gray03 6.018 ± 0.009 6.618 ± 0.014 TYC2 5907 6044 F051 HD 10647 F9 V gray06 5.581 ± 0.009 6.164 ± 0.014 TYC2 6126 6100 F052 HD 139664 F4 V gray06 4.681 ± 0.009 5.113 ± 0.014 TYC2 6649 6680 F053 HD 23754 F5 IV-V gray06 4.266 ± 0.009 4.711 ± 0.014 TYC2 6631 6623 F054 HD 160915 F5 V gray06 4.914 ± 0.009 5.399 ± 0.014 TYC2 6465 6457 F055 HD 114378 F5.5 V gray03 4.850 ± 0.010 5.340 ± 0.010 TDSC 6399 6438 F056 HD 46588 F8 V gray03 5.493 ± 0.009 6.050 ± 0.014 TYC2 6197 6189 F057 GJ 292 A F5 V Fe-0.5 gray06 5.118 ± 0.009 5.568 ± 0.014 TYC2 6554 6602 F058 HD 58946 F1 V gray03 4.198 ± 0.009 4.539 ± 0.014 TYC2 7035 7118 F059 HD 125276 F9 V Fe-1.5 CH-0.7 gray06 5.935 ± 0.009 6.454 ± 0.015 TYC2 6129 6326 F060 HD 114837 F6 V Fe-0.4 gray06 4.963 ± 0.009 5.455 ± 0.014 TYC2 6390 6430 F061 HD 69897 F6 V gray03 5.179 ± 0.009 5.672 ± 0.014 TYC2 6297 6426 F062 HD 129502 F2 V gray06 3.907 ± 0.009 4.323 ± 0.014 TYC2 6751 6751 F063 HD 109085 F2 V gray06 4.338 ± 0.009 4.728 ± 0.014 TYC2 6784 6873 F064 HD 210302 F6 V gray06 4.988 ± 0.009 5.491 ± 0.014 TYC2 6454 6387 F065 HD 185395 F3+ V gray03 4.534 ± 0.009 4.942 ± 0.014 TYC2 6747 6788 F066 GJ 822 A F7 V gray03 4.544 ± 0.009 5.087 ± 0.014 TYC2 6238 6238 F067 GJ 271 A F2 V kF0mF0 gray03 3.559 ± 0.009 3.921 ± 0.014 TYC2 6906 7010 F068 HD 5015 F8V BSC5 4.848 ± 0.009 5.441 ± 0.014 TYC2 6067 F069 HD 693 F8 V Fe-0.8 CH-0.5 gray06 4.950 ± 0.009 5.455 ± 0.014 TYC2 6255 6379 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 39

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

F070 HD 82434 F3 V Fe-0.7 gray06 3.910 ± 0.010 4.250 ± 0.010 TDSC 6837 7124 F071 HD 25457 F7 V gray03 5.437 ± 0.009 5.985 ± 0.014 TYC2 6308 6220 F072 HD 187691 F8V BSC5 5.185 ± 0.009 5.776 ± 0.014 TYC2 6074 F073 HD 173667 F6V BSC5 4.243 ± 0.009 4.734 ± 0.014 TYC2 6434 F074 HD 43386 F5 V gray03 5.084 ± 0.009 5.534 ± 0.014 TYC2 6602 6602 F075 HD 119756 F2 V gray06 4.272 ± 0.009 4.672 ± 0.014 TYC2 6781 6825 F076 HD 134083 F5 V gray03 4.974 ± 0.009 5.432 ± 0.014 TYC2 6540 6568 F077 HD 71243 F5 V Fe-0.8 gray06 4.095 ± 0.009 4.524 ± 0.014 TYC2 6625 6693 F078 HD 105211 F2 V gray06 4.177 ± 0.009 4.536 ± 0.014 TYC2 6950 7025 F079 GJ 818.1 A F9.5 V gray06 5.740 ± 0.009 6.370 ± 0.014 TYC2 6001 5950 F080 HD 68456 F6 V Fe-0.8 CH-0.4 gray06 4.792 ± 0.009 5.243 ± 0.014 TYC2 6467 6597 F081 HD 29875 F2 V gray06 4.479 ± 0.009 4.830 ± 0.014 TYC2 6991 7066 F082 HD 58855 F6V BSC5 5.409 ± 0.009 5.887 ± 0.014 TYC2 6486 F083 HD 202444 F2+ V gray03 3.830 ± 0.010 4.230 ± 0.010 TDSC 6621 6825 F084 HD 78154 F7IV-V HIP 4.869 ± 0.009 5.384 ± 0.014 TYC2 6341 F085 HD 27290 F1 V gray06 4.285 ± 0.009 4.613 ± 0.014 TYC2 7060 7188 F086 HD 219623 F7V BSC5 5.642 ± 0.009 6.226 ± 0.014 TYC2 6097 F087 HD 219482 F6 V gray06 5.705 ± 0.009 6.248 ± 0.014 TYC2 6290 6238 F088 HD 154417 F9 V gray03 6.057 ± 0.009 6.682 ± 0.014 TYC2 5985 5965 F089 HD 43042 F5.5 IV-V gray03 5.245 ± 0.009 5.708 ± 0.014 TYC2 6576 6547 F090 HD 33564 F7 V gray03 5.140 ± 0.009 5.659 ± 0.014 TYC2 6394 6326 F091 HD 25998 F8 V gray03 5.572 ± 0.009 6.129 ± 0.014 TYC2 6252 6189 F092 HD 3196 F8.5 V gray03 5.265 ± 0.009 5.862 ± 0.014 TYC2 6067 6054 F093 GJ 55.3 A F5 V gray06 4.997 ± 0.009 5.469 ± 0.014 TYC2 6505 6510 F094 HD 186858 K3+ V gray03 8.475 ± 0.013 9.668 ± 0.022 TYC2 4707 F095 HD 189245 F8.5 V Fe-0.6 CH-0.5 gray06 5.704 ± 0.009 6.222 ± 0.014 TYC2 6333 6330 F096 HD 739 F5 V gray06 5.289 ± 0.009 5.742 ± 0.014 TYC2 6548 6589 F097 HD 89449 F6 IV-V gray03 4.834 ± 0.009 5.332 ± 0.014 TYC2 6476 6406 F098 HD 55892 F3 V Fe-1.0 gray06 4.518 ± 0.009 4.851 ± 0.014 TYC2 6907 7161 F099 HD 160032 F4 V gray06 4.799 ± 0.009 5.227 ± 0.014 TYC2 6697 F100 HD 90089 F4 V kF2mF2 gray03 5.297 ± 0.009 5.692 ± 0.014 TYC2 6762 6849 F101 HD 22001 F3 V gray06 4.750 ± 0.009 5.163 ± 0.014 TYC2 6629 6765 F102 HD 16673 F8 V Fe-0.4 gray06 5.849 ± 0.010 6.398 ± 0.015 TYC2 6253 6217 F103 HD 108954 F9 V gray03 6.268 ± 0.009 6.878 ± 0.014 TYC2 6052 6012 F104 HD 91324 F9 V Fe-0.8 CH-0.7 gray06 4.946 ± 0.009 5.457 ± 0.014 TYC2 6287 6356 F105 HD 199260 F6 V gray06 5.745 ± 0.010 6.273 ± 0.015 TYC2 6241 6293 F106 HD 206826 F6 V gray03 4.745 ± 0.009 5.223 ± 0.014 TYC2 6309 6486 F107 CCDM 19598-0957 A F9 V gray03 5.941 ± 0.010 6.567 ± 0.015 TYC2 5947 5962 F108 HD 106516 F9 V Fe-1.7 CH-0.7 gray06 6.157 ± 0.010 6.637 ± 0.014 TYC2 6288 6477 F109 HD 68146 F6.5 V gray06 5.582 ± 0.009 6.100 ± 0.014 TYC2 6370 6330 F110 HD 19994 F8.5 V gray03 5.135 ± 0.009 5.750 ± 0.014 TYC2 6088 5997 F111 HD 213845 F5 V gray06 5.254 ± 0.009 5.720 ± 0.014 TYC2 6597 6535 F112 HD 16765 F7 V gray03 5.823 ± 0.010 6.344 ± 0.015 TYC2 6326 6319 F113 HD 89125 F6 V gray03 5.871 ± 0.010 6.401 ± 0.015 TYC2 6193 6285 F114 HD 168151 F5V BSC5 5.037 ± 0.009 5.487 ± 0.014 TYC2 6602 F115 HD 162003 F5IV-V BSC5 4.600 ± 0.009 5.057 ± 0.014 TYC2 6572 F116 HD 167425 F9.5 V gray06 6.247 ± 0.009 6.884 ± 0.014 TYC2 6046 5929 F117 HD 219571 F4 V gray06 4.033 ± 0.009 4.459 ± 0.014 TYC2 6618 6706 F118 HD 160922 F5V BSC5 4.821 ± 0.009 5.279 ± 0.014 TYC2 6568 F119 HD 11171 F2 III-IV gray03 4.694 ± 0.009 5.054 ± 0.014 TYC2 7087 7020 F120 HD 101177 F9.5 V gray03 6.534 ± 0.010 7.167 ± 0.015 TYC2 5932 5941 F121 HD 100180 F9.5 V gray03 6.331 ± 0.011 6.960 ± 0.016 TYC2 6021 5953 F122 HD 7439 F5 V gray03 5.188 ± 0.009 5.647 ± 0.014 TYC2 6465 6564 F123 HD 190422 F9 V CH-0.4 gray06 6.311 ± 0.010 6.879 ± 0.015 TYC2 6179 6151 F124 HD 4676 F8 V gray03 5.120 ± 0.009 5.674 ± 0.014 TYC2 6254 6199 F125 HD 164259 F2 V gray03 4.660 ± 0.009 5.052 ± 0.014 TYC2 6771 6863 F126 HD 214953 F9.5 V gray06 6.059 ± 0.009 6.673 ± 0.014 TYC2 6104 6000 F127 HD 99028 F5 IV gray03 4.056 ± 0.009 4.484 ± 0.014 TYC2 6600 6697 F128 HIP 46733 F0IV BSC5 3.679 ± 0.009 4.046 ± 0.014 TYC2 6985 F129 HD 111456 F5V BSC5 5.885 ± 0.009 6.389 ± 0.014 TYC2 6383 F130 GJ 105.4 A F5 V gray06 4.874 ± 0.009 5.332 ± 0.014 TYC2 6516 6568 Continued on next page...

40 N. M. Phillips et al.

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

A001 HD 48915 A0mA1 Va gray03 -1.430 ± -1.430 ± bes90 9580 9646 A002 HD 187642 A7 Vn gray03 0.955 ± 0.010 1.248 ± 0.012 TYC 7800 7383 A003 HD 172167 A0 Va gray03 0.029 ± 0.017 ± bes90 9519 9765 A004 HD 216956 A4 V gray06 1.248 ± 0.007 1.407 ± 0.009 TYC 8399 8265 A005 HD 102647 A3 Va gray03 2.143 ± 0.004 2.300 ± 0.003 TYC 8378 8280 A006 HD 60179 A1.5 IV+ gray03 1.944 ± 1.991 ± CNS3 9194 A007 HD 76644 A7 V(n) gray03 3.128 ± 0.009 3.358 ± 0.014 TYC2 7769 7769 A008 HD 159561 A5III BSC5 2.106 ± 0.003 2.315 ± 0.003 TYC 7909 A009 HD 203280 A8 Vn gray03 2.458 ± 0.009 2.725 ± 0.014 TYC2 7773 7537 A010 HD 128898 A7 Vp SrCrEu gray06 3.189 ± 0.009 3.474 ± 0.014 TYC2 7631 7429 A011 HD 97603 A5 IV(n) gray03 2.544 ± 0.009 2.710 ± 0.014 TYC2 8037 8213 A012 HD 11636 kA4hA5mA5 Va gray03 2.651 ± 0.009 2.827 ± 0.014 TYC2 8300 8140 A013 HD 115892 kA1.5hA3mA3 Va gray06 2.732 ± 0.009 2.814 ± 0.014 TYC2 10207 8883 A014 HD 39060 A6 V gray06 3.870 ± 0.009 4.056 ± 0.014 TYC2 8052 8069 A015 HD 141795 kA2hA5mA7 V gray03 3.714 ± 0.009 3.885 ± 0.014 TYC2 8176 A016 HD 38678 A2 IV-V(n) gray06 3.541 ± 0.009 3.671 ± 0.014 TYC2 8337 8487 A017 HD 118098 A2 Van gray03 3.380 ± 0.009 3.522 ± 0.014 TYC2 8633 8394 A018 HD 139006 A1 IV gray03 2.217 ± 0.003 2.252 ± 0.002 TYC 9584 9306 A019 HD 156164 A1 IVn gray03 3.115 ± 0.009 3.219 ± 0.014 TYC2 8879 8697 A020 HD 130841 kA2hA5mA4 IV-V gray06 2.742 ± 0.009 2.930 ± 0.014 TYC2 8128 8054 A021 HD 2262 A5 IVn gray06 3.953 ± 0.009 4.151 ± 0.014 TYC2 7922 7984 A022 HD 197157 A9 IV gray06 4.530 ± 0.009 4.827 ± 0.014 TYC2 7448 7360 A023 HD 16970 A2 Vn gray03 3.551 ± 0.009 3.644 ± 0.014 TYC2 8673 8789 A024 HD 95418 A1 IVps (Sr II) gray03 2.349 ± 0.002 2.385 ± 0.002 TYC 9342 9297 A025 HD 74956 A1 Va(n) gray06 1.949 ± 0.003 2.050 ± 0.002 TYC 9021 8722 A026 HD 106591 A2 Vn gray03 3.298 ± 0.009 3.410 ± 0.014 TYC2 8613 8632 A027 HD 40183 A1 IV-Vp... gray03 1.904 ± 0.005 1.989 ± 0.005 TYC 9024 8857 A028 CCDM 13240+5456 A A1.5 Vas gray03 2.227 ± 0.003 2.290 ± 0.002 TYC 9330 9050 A029 HD 99211 A7 V(n) gray06 4.091 ± 0.009 4.302 ± 0.014 TYC2 7805 7895 A030 HD 177724 A0 IV-Vnn gray03 2.958 ± 0.009 2.993 ± 0.014 TYC2 9190 9306 A031 HD 157792 kA5hA9mF1 III gray06 4.189 ± 0.009 4.498 ± 0.014 TYC2 7440 7292 A032 HD 103287 A1 IV(n) gray03 2.399 ± 0.009 2.456 ± 0.014 TYC2 9272 9104 A033 CCDM 02449+1007 A A9 IIIp gray03 4.305 ± 0.009 4.635 ± 0.014 TYC2 7225 7177 A034 HD 165777 A5 V gray03 3.722 ± 0.009 3.881 ± 0.014 TYC2 8400 8265 A035 HD 108767 A0 IV(n) kB9 gray06 2.926 ± 0.009 2.918 ± 0.014 TYC2 10207 9727 A036 CCDM 19026-2953 A A2.5 Va gray06 2.599 ± 0.009 2.717 ± 0.014 TYC2 8799 8583 A037 HD 155125 A2 IV-V gray06 3.050 ± 0.010 3.180 ± 0.010 TDSC 8788 8487 A038 HD 18978 A3 IV-V gray06 4.092 ± 0.009 4.278 ± 0.014 TYC2 8045 8069 A039 HD 180777 A9V BSC5 5.144 ± 0.009 5.462 ± 0.014 TYC2 7242 A040 HD 33111 A3 IV gray03 2.779 ± 0.009 2.949 ± 0.014 TYC2 8377 8184 A041 HD 210418 A1 Va gray06 3.519 ± 0.009 3.612 ± 0.014 TYC2 8569 8789 A042 HD 87696 A7 V(n) gray03 4.498 ± 0.009 4.707 ± 0.014 TYC2 7839 7909 A043 HD 172555 A7 V gray06 4.793 ± 0.009 5.015 ± 0.014 TYC2 7846 7822 A044 HD 70060 A8 V gray06 4.460 ± 0.009 4.700 ± 0.014 TYC2 7790 7705 A045 HD 78209 Am HIP 4.479 ± 0.009 4.795 ± 0.014 TYC2 7253 A046 HD 173880 A5III BSC5 4.356 ± 0.009 4.501 ± 0.014 TYC2 8371 A047 HD 27045 A3m BSC5 4.947 ± 0.009 5.227 ± 0.014 TYC2 7459 A048 HD 125161 A9V BSC5 4.763 ± 0.009 5.002 ± 0.014 TYC2 7711 A049 HD 50241 A8 Vn kA6 gray06 3.262 ± 0.009 3.507 ± 0.014 TYC2 7536 7673 A050 HD 209790 Am HIP 4.446 ± 0.009 4.813 ± 0.014 TYC2 6985 A051 HD 202730 A5 V(n) gray06 4.504 ± 0.009 4.683 ± 0.014 TYC2 8114 8118 A052 HD 159560 Am HIP 4.870 ± 0.009 5.185 ± 0.014 TYC2 7259 A053 HD 125162 A3 Va λ Boo... gray03 4.181 ± 0.009 4.274 ± 0.014 TYC2 8512 8789 A054 HD 8538 A5Vv SB HIP 2.663 ± 0.009 2.842 ± 0.014 TYC2 8118 A055 HD 135379 A3 Va gray06 4.071 ± 0.009 4.184 ± 0.014 TYC2 8641 8623 A056 HD 56537 A3V... HIP 3.575 ± 0.009 3.709 ± 0.014 TYC2 8456 A057 HD 88955 A2 Va gray06 3.836 ± 0.009 3.907 ± 0.014 TYC2 8829 8979 A058 HD 213558 A1V BSC5 3.758 ± 0.009 3.784 ± 0.014 TYC2 9392 A059 HD 161868 A1 Vn kA0mA0 gray03 3.737 ± 0.009 3.789 ± 0.014 TYC2 8951 9149 A060 HD 47105 A1.5 IV+ gray03 1.950 ± 1.950 ± BSC5 8953 9646 A061 HD 188228 A0 Va gray06 3.938 ± 0.009 3.928 ± 0.014 TYC2 9896 9747 A062 HD 83446 A7 V gray06 4.358 ± 0.009 4.552 ± 0.014 TYC2 7977 8012 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 41

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

A063 HD 222603 A7 V gray03 4.514 ± 0.009 4.741 ± 0.014 TYC2 7742 7789 A064 HD 20320 kA4hA9mA9 V gray06 4.821 ± 0.009 5.067 ± 0.014 TYC2 7680 7667 A065 CCDM 15278+2906 A A8 V: SrCrEu gray03 3.672 ± 0.009 3.990 ± 0.014 TYC2 7624 7242 A066 HD 104513 A7m HIP 5.241 ± 0.009 5.534 ± 0.014 TYC2 7383 A067 HD 14055 A1Vnn BSC5 3.999 ± 0.009 4.025 ± 0.014 TYC2 9392 A068 HD 91312 A7IV BSC5 4.742 ± 0.009 4.970 ± 0.014 TYC2 7782 A069 HD 112413 A0 II-IIIp SiEuCr gray03 2.845 ± 0.009 2.788 ± 0.014 TYC2 10247 A070 HD 12111 A3IV BSC5 4.647 ± 0.009 4.787 ± 0.014 TYC2 8409 A071 HD 109536 A7 V gray06 5.143 ± 0.009 5.394 ± 0.014 TYC2 7646 7635 A072 HD 31295 A3 Va λ Boo... gray03 4.659 ± 0.009 4.749 ± 0.014 TYC2 8611 8815 A073 HD 16754 A1 Vb gray06 4.736 ± 0.009 4.821 ± 0.014 TYC2 9132 8857 A074 HD 79439 A5V BSC5 4.830 ± 0.009 5.042 ± 0.014 TYC2 7889 A075 HD 25490 A0.5 Va gray06 3.888 ± 0.009 3.939 ± 0.014 TYC2 9017 9158 A076 HD 110411 A3 Va λ Boo... gray03 4.877 ± 0.009 4.958 ± 0.014 TYC2 8671 8892 A077 HD 17093 A7III-IV BSC5 5.205 ± 0.009 5.444 ± 0.014 TYC2 7711 A078 HD 184006 A5Vn BSC5 3.775 ± 0.009 3.939 ± 0.014 TYC2 8228 A079 HD 102124 A4V BSC5 4.864 ± 0.009 5.045 ± 0.014 TYC2 8104 A080 HD 177196 A7V BSC5 5.030 ± 0.009 5.235 ± 0.014 TYC2 7936 A081 HD 44769 A8 V(n) gray03 4.423 ± 0.009 4.629 ± 0.014 TYC2 7732 7929 A082 HD 71155 A0 Va gray03 3.876 ± 0.009 3.868 ± 0.014 TYC2 9556 9727 A083 HD 80081 A1V HIP 3.916 ± 0.009 3.963 ± 0.014 TYC2 9195 A084 HD 78045 kA3hA5mA5 V gray06 4.011 ± 0.009 4.185 ± 0.014 TYC2 8198 8155 A085 HD 178253 A2 Va gray06 4.095 ± 0.009 4.167 ± 0.014 TYC2 8950 8970 A086 HD 13161 A5 IV gray03 3.017 ± 0.009 3.196 ± 0.014 TYC2 8186 8118 A087 HD 95608 A1m BSC5 4.405 ± 0.009 4.472 ± 0.014 TYC2 9014 A088 HD 102249 A7 V gray06 3.638 ± 0.009 3.825 ± 0.014 TYC2 7943 8061 A089 HD 215789 A2 IVn SB2 gray06 3.479 ± 0.009 3.586 ± 0.014 TYC2 8137 8673 A090 HD 5448 A5V BSC5 3.868 ± 0.009 4.026 ± 0.014 TYC2 8272 A091 HD 137898 A7 IV houk 5.178 ± 0.009 5.430 ± 0.014 TYC2 7629 A092 HD 165040 A7P SR houk 4.359 ± 0.009 4.625 ± 0.014 TYC2 7543 A093 HD 110304 A1 IV+ gray06 2.817 ± 0.009 2.844 ± 0.014 TYC2 9082 9382 A094 HD 49434 A8/9 IV houk 5.767 ± 0.009 6.076 ± 0.014 TYC2 7292 A095 HD 109787 A2 V houk 3.848 ± 0.009 3.913 ± 0.014 TYC2 9032 A096 HD 154494 A4IV BSC5 4.889 ± 0.009 5.039 ± 0.014 TYC2 8333 A097 CCDM 16278-0822 A A1 IV houk 4.653 ± 0.009 4.854 ± 0.014 TYC2 7964 A098 HD 85376 A5IV BSC5 5.319 ± 0.009 5.575 ± 0.014 TYC2 7604 A099 HD 6961 A7Vvar HIP 4.343 ± 0.009 4.536 ± 0.014 TYC2 8019 A100 HD 198639 A4me... HIP 5.074 ± 0.009 5.290 ± 0.014 TYC2 7862 A101 HD 130109 Ap (A0 IVnn SiII) houk 3.716 ± 0.009 3.720 ± 0.014 TYC2 9606 A102 HD 146624 A0 (V) houk 4.785 ± 0.009 4.815 ± 0.014 TYC2 9354 A103 HD 1404 A2V BSC5 4.512 ± 0.009 4.590 ± 0.014 TYC2 8918 A104 HD 90132 A8 V houk 5.359 ± 0.009 5.617 ± 0.014 TYC2 7592 A105 HD 19107 A4 IV/V houk 5.281 ± 0.009 5.485 ± 0.014 TYC2 7943 A106 HD 210049 A1.5 IVn gray06 4.502 ± 0.009 4.572 ± 0.014 TYC2 8907 8988 A107 HD 165189 A5 V houk 5.652 ± 0.009 5.893 ± 0.014 TYC2 7699 A108 HD 46304 A7 II/III houk 5.630 ± 0.009 5.902 ± 0.014 TYC2 7507 A109 HD 223352 A0 V houk 4.572 ± 0.009 4.578 ± 0.014 TYC2 9586 A110 HD 89021 A2IV BSC5 3.428 ± 0.009 3.476 ± 0.014 TYC2 9186 A111 HD 123998 A2MA7-F2 houk 4.920 ± 0.009 5.184 ± 0.014 TYC2 7555 A112 HD 15089 A5p Sr HIP 4.627 ± 0.009 4.732 ± 0.014 TYC2 8689 A113 HD 23281 A6 V houk 5.624 ± 0.010 5.846 ± 0.014 TYC2 7822 A114 HD 28527 A6IV BSC5 4.785 ± 0.009 4.982 ± 0.014 TYC2 7991 A115 HD 37594 A9 V houk 6.010 ± 0.009 6.321 ± 0.014 TYC2 7281 A116 HD 192640 A2V BSC5 4.962 ± 0.009 5.121 ± 0.014 TYC2 8265 A117 HD 197950 A8V BSC5 5.611 ± 0.009 5.841 ± 0.014 TYC2 7769 A118 HD 15008 A1/2 V houk 4.075 ± 0.009 4.128 ± 0.014 TYC2 9140 A119 HD 212728 A3/5 V houk 5.589 ± 0.009 5.804 ± 0.014 TYC2 7869 A120 HD 186219 A3MA3-A8 houk 5.422 ± 0.009 5.682 ± 0.014 TYC2 7579 A121 HD 222345 A7 IV houk 5.008 ± 0.009 5.276 ± 0.014 TYC2 7531 A122 HD 48097 A2V BSC5 5.225 ± 0.009 5.299 ± 0.014 TYC2 8953 A123 HD 213398 A1 V houk 4.280 ± 0.009 4.312 ± 0.014 TYC2 9335 A124 CCDM 16035-5747 A A5 IVS houk 4.697 ± 0.009 4.938 ± 0.014 TYC2 7699 Continued on next page...

42 N. M. Phillips et al.

Table 5. A-K primary spectral types, Tycho photometry and effective temperatures (continued)

UNS ID Primary name SpT Ref. V_T B_T Ref. T_{eff,G} T_{eff,T} (mag) (mag) (K) (K)

A125 HD 159492 A5 IV/V houk 5.267 ± 0.009 5.478 ± 0.014 TYC2 7895 A126 HD 37507 A2 V houk 4.790 ± 0.009 4.947 ± 0.014 TYC2 8280 A127 HD 140436 A1Vs HIP 4.040 ± 0.010 4.010 ± 0.010 TDSC 9955 A128 HD 141296 A9 III houk 6.152 ± 0.010 6.457 ± 0.015 TYC2 7314 A129 HD 28546 Am HIP 5.482 ± 0.009 5.762 ± 0.014 TYC2 7459 A130 HD 16555 A6 V houk 5.328 ± 0.009 5.629 ± 0.014 TYC2 7337

Table 6. M-type primary spectral types, effective temperatures and Johnson B, V photometry: spectral type and reference, T_{eff} determined from spectral type, Johnson V magnitude and references, Johnson (B − V ) colour and references. Where multiple references are given for the photometry, the value given here is the mean of the refereneced values.

UNS ID name SpT SpT ref T_{eff} (SpT) V_J V_J ref (B − V )_J (B − V )_J ref (K) (mag) (mag)

M001 HIP 87937 M4 haw95 3100 9.55 wei96,bes90 1.75 wei96,bes90 M002 GJ 406 M5.5 haw95 2700 13.48 wei96,bes90 2.00 wei96,bes90 M003 HD 95735 M2 haw95 3400 7.50 egg74 1.51 egg74 M004 GJ 65 A M5.5 haw95 2700 12.57 CNS3 1.85 CNS3 M005 HIP 92403 M3.5 haw95 3175 10.43 wei96,bes90 1.75 wei96,bes90 M006 GJ 905 M5 haw95 2800 12.29 wei96 1.91 wei96 M007 HD 217987 M0.5 haw96 3700 7.37 egg74 1.48 egg74 M008 HIP 57548 M4 haw95 3100 11.14 wei96,bes90 1.76 wei96,bes90 M009 GJ 866 AB M5.5 haw95 2700 12.34 wei96,bes90 1.98 wei96,bes90 M010 HD 173739 M3 haw95 3250 8.90 wei96 1.52 wei96 M011 HD 1326 M1 haw95 3600 8.09 egg74 1.56 egg74 M012 GJ 1111 M6 haw95 2600 14.84 wei96,bes90 2.05 bes90 M013 LHS 1565 M5.5 haw96 2700 13.03 rod74 1.90 rod74 M014 HIP 5643 M4.5 haw95 2950 12.06 wei96,bes90 1.81 wei96,bes90 M015 HIP 36208 M3.5 haw95 3175 9.86 wei96,bes90 1.57 wei96,bes90 M016 SO 0253+1652 M6.0 V hen06 2600 15.14 hen06 M017 HD 33793 M1.0 haw96 3600 8.85 bes90 1.56 bes90 M018 HD 239960 M3 haw95 3250 9.57 wei96 1.66 wei96 M019 GJ 234 A M4.5 haw95 2950 11.11 wei96,bes90 1.71 wei96,bes90 M020 HIP 80824 M3.5 haw95 3175 10.08 wei96,bes90 1.58 wei96,bes90 M021 HD 225213 M1.5 haw96 3500 8.53 bes90 1.47 bes90 M022 GJ 473 A M5 haw95 2800 12.45 wei96,bes90 1.85 wei96,bes90 M023 GJ 83.1 M4.5 haw95 2950 12.29 wei96,bes90 1.82 wei96,bes90 M024 HIP 86162 M3 haw95 3250 9.17 wei96 1.47 wei96 M025 GJ 3622 M6.5 haw95 2550 15.60 wei96 2.10 YPC M026 HIP 85523 M2.5 haw96 3325 9.37 bes90 1.53 bes90 M027 GJ 1245 A M5.5 haw95 2700 13.41 wei96 1.90 YPC M028 HIP 113020 M4 haw95 3100 10.18 wei96,bes90 1.59 wei96,bes90 M029 GJ 1002 M5.5 haw95 2700 13.76 wei96 1.97 wei96 M030 GJ 3618 M5.0 V hen06 2800 13.90 hen06 1.82 CNS3 M031 HIP 54211 M0.5 haw95 3700 8.77 wei96 1.57 wei96 M032 GJ 388 M3 haw95 3250 9.32 leg92 1.53 leg92 M033 HD 204961 M1.5 haw96 3500 8.66 bes90 1.49 bes90 M034 HIP 86214 M3.5 haw96 3175 10.95 bes90 1.65 bes90 M035 HIP 112460 M3.5 haw95 3175 10.22 wei96 1.61 wei96 M036 GJ 1116 B M5.5 haw95 2700 14.06 CNS3 1.84 CNS3 M037 GJ 3379 M4 haw95 3100 11.33 YPC 1.68 YPC M038 GJ 3323 M4 haw95 3100 12.15 wei96 1.80 wei96 M039 HIP 57544 M3.5 haw95 3175 10.79 wei96 1.58 wei96 M040 HD 119850 M1.5 haw95 3500 8.46 wei96 1.44 wei96 M041 GJ 169.1 A M4 haw95 3100 11.04 wei96 1.64 leg92 M042 HD 265866 M3 haw95 3250 10.02 wei96 1.57 wei96 M043 HD 36395 M1.5 haw95 3500 7.95 bes90 1.47 bes90 M044 HIP 103039 M4 V gray06 3100 11.41 HIC 1.65 HIC M045 HD 42581 M0.5 haw95 3700 8.14 bes90 1.50 bes90 M046 HIP 86990 M2.0 haw96 3400 10.76 bes90 1.67 bes90 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 43

Table 6. M-type primary spectral types, effective temperatures and Johnson B, V photometry (continued)

UNS ID name SpT SpT ref T_{eff} (SpT) V_J V_J ref (B − V )_J (B − V )_J ref (K) (mag) (mag)

M047 HD 180617 M2.5 haw95 3325 9.11 wei96,bes90 1.50 wei96,bes90 M048 HIP 26857 M4 haw95 3100 11.54 wei96,bes90 1.62 wei96,bes90 M049 LHS 60 M4.5 haw96 2950 12.23 rod74 1.70 rod74 M050 HIP 76074 M2.5 haw96 3325 9.31 bes90 1.53 bes90 M051 CCDM 00155-1608 A M4 haw95 3100 12.03 CNS3 1.72 CNS3 M052 HIP 117473 M1 haw95 3600 8.99 wei96 1.47 wei96 M053 HIP 37766 M4.5 haw95 2950 11.19 wei96,bes90 1.60 wei96,bes90 M054 HIP 34603 M4.5 haw95 2950 11.48 wei96 1.72 wei96 M055 HIP 71253 M4 haw95 3100 11.32 wei96,bes90 1.62 wei96,bes90 M056 HIP 74995 M3 haw95 3250 10.57 wei96,bes90 1.61 wei96,bes90 M057 GJ 896 A M3.5 haw95 3175 10.13 wei96 1.61 wei96 M058 LHS 2090 M6.0 V hen06 2600 16.10 hen06 M059 GJ 3737 M4.5 haw96 2950 12.74 egg79 1.69 egg79 M060 GJ 661 A M3.5 haw95 3175 9.37 wei96 1.46 wei96 M061 GJ 3959 M5 haw95 2800 14.76 wei87 M062 GJ 644 A M3 haw95 3250 9.02 wei96,bes90 1.57 wei96,bes90 M063 HIP 80459 M1.5 haw95 3500 10.10 leg92 1.60 leg92 M064 LHS 271 M4.5 haw96 2950 12.78 rod74 1.73 rod74 M065 GJ 1156 M5 haw95 2800 13.80 wei96 1.88 egg79 M066 GJ 3877 M7c haw95 2500 17.05 bes91 M067 HIP 53767 M2.5 haw95 3325 10.02 leg92 1.54 leg92 M068 HIP 106106 M3.5 haw95 3175 10.31 leg92 1.61 leg92 M069 GJ 3522 M3.5 haw95 3175 10.90 wei91 1.67 wei91 M070 HIP 53020 M4 haw95 3100 11.66 wei96,bes90 1.66 wei96,bes90 M071 HD 216899 M1.5 haw95 3500 8.65 wei96,bes90 1.50 wei96,bes90 M072 GJ 299 M4.5 haw95 2950 12.82 wei96 1.75 wei96 M073 GJ 3193 B M3 haw95 3250 11.22 hen06 1.69 CNS3 M074 LHS 22 M4.5 haw96 2950 13.58 rod74 1.93 rod74 M075 HD 199305 M0.5 haw95 3700 8.56 wei96 1.51 wei96 M076 HIP 51317 M2 haw95 3400 9.64 bes90 1.52 bes90 M077 GJ 4063 M3.5 haw95 3175 11.42 wei91 M078 GJ 1286 M5.5 haw95 2700 14.67 wei96 1.96 YPC M079 GJ 4053 M4.5 haw95 2950 13.49 wei96 1.83 YPC M080 NLTT 54872 M4.0 V RECXX 3100 12.59 RECXX M081 GJ 4274 M4.5 haw95 2950 13.26 wei96 1.84 YPC M082 GJ 4248 M3.5 haw96 3175 11.80 egg80 1.65 egg80 M083 HIP 83945 M3.5 haw95 3175 11.77 HIC 1.70 HIC M084 GJ 1224 M4.5 haw95 2950 13.61 wei96 1.80 YPC M085 GJ 3378 M3.5 haw95 3175 11.71 wei96 1.60 wei96 M086 HIP 12781 M3 haw95 3250 10.57 wei96 1.56 wei96 M087 HIP 65859 M0.5 haw95 3700 9.06 wei96,bes90 1.51 wei96,bes90 M088 GJ 3207 M3.5 haw96 3175 11.51 egg80 1.51 egg80 M089 GJ 2005 M5.5 haw95 2700 15.35 lei00 1.82 lei00 M090 GJ 1093 M5 haw95 2800 14.52 leg92 1.92 leg92 M091 HD 165222 M1 haw95 3600 9.38 wei96,bes90 1.52 wei96,bes90 M092 HIP 61874 M3.0 haw96 3250 12.24 bes90 1.73 bes90 M093 HIP 5496 M2.0 haw96 3400 9.81 bes90 1.54 bes90 M094 GJ 831 A M4.5 haw95 2950 12.01 wei96,bes90 1.68 wei96,bes90 M095 HIP 49986 M1.5 haw95 3500 9.29 bes90 1.51 bes90 M096 LHS 1989 M4 haw95 3100 12.16 bes90 1.64 bes90 M097 HIP 101180 M2.5 haw95 3325 10.56 wei96 1.58 wei96 M098 HIP 80346 M2.5 haw95 3325 10.28 wei96 1.50 wei96 M099 GJ 257 A M3.0 haw96 3250 10.76 leg92 1.70 leg92 M100 HIP 86287 M1 haw95 3600 9.61 wei96 1.54 wei96 M101 GJ 1289 M4 haw95 3100 12.57 wei96 1.68 wei96 M102 SCR 0740-4257 M4.5: M_V 2950 13.81 RECXX M103 GJ 493.1 M4.5 haw95 2950 13.41 bes90 1.77 bes90 M104 GJ 747 A M3 haw95 3250 11.26 wei96 1.71 wei96 M105 SCR 1138-7721 M5.0 V RECXX 2800 14.78 RECXX M106 GJ 1151 M4.5 haw95 2950 13.24 wei96 1.85 egg79 M107 GJ 1227 M4.5 haw95 2950 13.44 wei96,bes90 1.71 bes90 M108 HIP 4856 M3 haw95 3250 9.98 wei96 1.43 wei96 Continued on next page...

44 N. M. Phillips et al.

Table 6. M-type primary spectral types, effective temperatures and Johnson B, V photometry (continued)

UNS ID name SpT SpT ref T_{eff} (SpT) V_J V_J ref (B − V )_J (B − V )_J ref (K) (mag) (mag)

M109 HIP 38956 M3.5 haw95 3175 11.98 wei96 1.63 wei96 M110 GJ 1230 B M5 haw95 2800 12.21 YPC 1.69 YPC M111 GJ 618 A M2.0 haw96 3400 10.60 bes90 1.57 bes90 M112 HIP 62452 M3.5 haw95 3175 11.39 bes90 1.57 bes90 M113 GJ 232 M4.5 haw95 2950 13.06 wei96 1.76 YPC M114 GJ 1154 AB M5 haw95 2800 13.73 wei96 1.77 CNS3 M115 GJ 3146 M5.5 haw95 2700 15.79 YPC 1.98 YPC M116 GJ 1057 M5 haw95 2800 13.86 wei96 1.81 wei96 M117 GJ 3454 M5 haw95 2800 14.00 hen06

Table 7. Component cross identifications with common catalogues: system ID, CCDM ID and component, Henry Draper (HD/HDE) ID, Gleise & Jahreiss (CNS3) ID, Luyten Half Second ID, New Luyten Two Tenths ID (record number in original NLTT), Harvard Revised (BSC5) ID, Positions and Proper Motions ID, Hipparcos ID, Tycho ID, Tycho Double Star Catalogue ID and component, Bonner Durchmusterung ID, Cordoba Durchmusterung ID, Cape Photographic Durchmusterung ID, Yale Parallax Catalogue (PLX) ID, 2MASS Point Source Catalogue ID (these are determined by simple cone search and may not be reliable in some cases).

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

M001 699 57 45718 87937 425-2502-1 +04 3561a 4098.00 17574849+0441405 M002 406 36 2553.00 10562886+0700527 M003 11033+3558 A 95735 411 37 26105 75640 54035 2521-2279-1 +36 2147 2576.00 11032027+3558203 M004 65 A 9 5504 343.10 01390120-1757026 M004 65 B 10 5505 343.10 01390120-1757026 M005 729 3414 47045 734465 92403 6859-1332-1 -23 14742 4338.00 18494929-2350101 M006 905 549 57692 5736.00 23415498+4410407 M007 217987 887 70 55782 400306 114046 7512-1263-1 -36 15693 -36 9694 5584.00 23055131-3551130 M008 447 315 28570 57548 272-1051-1 2730.00 11474440+0048164 M009 866 AB 68 54407 5475.00 22383372-1517573 M010 18428+5937 A 173739 725 A 58 46947 36785 91768 3930-1791-1 48381 A +59 1915 4330.00 18424666+5937499 M010 18428+5937 B 173740 725 B 59 46948 36786 91772 3930-1791-2 48381 B +59 1915s 4330.00 18424688+5937374 M011 00184+4401 A 1326 15 A 3 919 42798 1475 2794-157-1 774 A +43 44 49.00 00182256+4401222 M011 00184+4401 B 15 B 4 923 49.00 00182549+4401376 M012 1111 248 19635 2016.01 08294949+2646348 M013 1061 1565 03355969-4430453 M014 54.1 138 4016 5643 5851-171-1 248.01 01123052-1659570 M015 273 33 17881 36208 173-3208-1 +05 1668 1755.00 07272450+0513329 M016 02530084+1652532 M017 33793 191 29 14668 24186 8078-1749-1 -45 1841 -44 612 1181.00 05114046-4501051 M018 22281+5741 A 239960 860 A 3814 53952 40695 110893 3991-92-1 61468 A +56 2783 5438.00 22275958+5741453 M018 22281+5741 B 860 B 3815 110893 3991-92-2 61468 B 5438.00 22275958+5741453 M019 06294-0249 A 234 A 1849 16580 30920 4789-3303-1 15215 A 1509.00 06292339-0248499 M019 06294-0249 B 234 B 1850 16581 30920 4789-3303-1 15215 A 1509.00 06292339-0248499 M020 628 419 42927 80824 5635-1241-1 -12 4523 3746.00 16301808-1239434 M021 225213 1 1 134 439 6995-1264-1 -37 15492 -37 9435 5817.00 00052423-3721257 M022 473 A 333 2890.00 12331738+0901157 M022 473 B 2890.00 12331738+0901157 M023 83.1 11 6690 412.02 02001278+1303112 M024 17366+6822 B 687 450 45190 20469 86162 4428-1943-1 44802 B +68 946 4029.00 17362594+6820220 M025 3622 292 25392 2516.02 10481258-1120082 M026 674 449 44819 762755 85523 8346-37-1 -46 11540 -46 8664 3958.00 17283991-4653424 M027 1245 A 3494 48414 4706.01 19535443+4424541 M027 1245 B 3495 48415 4706.01 19535508+4424550 M028 876 530 55130 113020 5819-1255-1 -15 6290 5546.00 22531672-1415489 M029 1002 2 248 9.01 00064325-0732147 M030 3618 288 2511.01 10442131-6112384 M031 11055+4332 A 412 A 38 26245 52239 54211 3012-2528-1 30729 A +44 2051 2582.00 11052903+4331357 M031 11055+4332 B 412 B 39 26247 2582.00 11053133+4331170 M032 10199+1951 C 388 5167 24015 127309 1423-174-1 28792 C +20 2465 2420.00 10193634+1952122 M033 204961 832 3685 51502 327332 106440 8431-60-1 -49 13515 -49 11439 5190.00 21333397-4900323 M034 682 451 45107 86214 7896-3808-1 -44 11909 3992.00 17370367-4419088 M035 22468+4420 A 873 3853 54837 63398 112460 3226-2288-1 62311 A +43 4305 5520.00 22464980+4420030 M036 1116 A 2076 20638 2144.03 08581519+1945470 M036 1116 B 2077 20637 2144.03 08581519+1945470 M037 3379 15908 134-605-1 1383.02 06000351+0242236 M038 3323 1723 14393 05015746-0656459 M039 445 2459 28539 57544 4553-192-1 2722.00 11474143+7841283 M040 119850 526 47 35133 130055 67155 899-789-1 +15 2620 3135.00 13454354+1453317 M041 04312+5858 A 169.1 A 26 13373 21088 3744-412-1 9541 A 986.01 04311147+5858375 M041 04312+5858 B 169.1 B 27 13375 21088 3744-2062-1 9541 B 986.01 M042 265866 251 1879 17147 33226 2441-572-1 1609.00 06544902+3316058 M043 05314-0341 A 36395 205 30 15215 188143 25878 4770-574-1 12014 A -03 1123 1255.00 05312734-0340356 M044 50038 103039 6348-400-1 20523304-1658289 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

M045 42581 229 1827 16172 249953 29295 5945-765-1 -21 1377 -21 1138 1430.00 06103462-2151521 M046 693 454 45375 86990 8737-2175-1 4040.00 17463427-5719081 M047 19169+0510 A 180617 752 A 473 47619 167538 94761 472-1252-1 50376 A +04 4048 4494.00 19165526+0510086 M047 19169+0510 B 752 B 474 47621 4494.00 19165762+0509021 M048 213 31 15489 26857 722-455-1 1305.00 05420897+1229252 M049 754 60 4505.00 19204795-4533283 M050 588 397 40449 76074 7844-1976-1 -40 9712 -40 7021 3501.00 15321302-4116314 M051 00155-1608 A 1005 AB 1047 763 1242 5839-1083-1 650 A 40.01 00152799-1608008 M051 00155-1608 B 1005 AB 1047 763 1242 5839-1083-1 650 A 40.01 00152799-1608008 M052 908 550 58069 174453 117473 586-610-1 +01 4774 5763.00 23491255+0224037 M053 285 1943 18373 37766 183-2190-1 1827.00 07444018+0333089 M054 268 226 17470 34603 2944-1956-1 1668.00 07100180+3831457 M055 555 2945 37751 71253 5572-804-1 -11 3759 3296.00 14341683-1231106 M056 581 394 39886 74995 5594-1093-1 -07 4003 3458.00 15192689-0743200 M057 23319+1956 A 896 A 3965 57135 116132 1723-23-1 64112 A +19 5116 5694.00 23315208+1956142 M057 23319+1956 B 896 B 3966 57136 116132 1723-23-2 64112 B 5694.00 23315244+1956138 M058 2090 20726 09002359+2150054 M059 3737 337 12384914-3822527 M060 17121+4540 A 155876 661 A 433 44362 56005 84140 3501-1952-1 43695 AB +45 2505 3907.00 17120780+4539587 M060 17121+4540 B 155876 661 B 434 44363 56005 84140 3501-1952-1 43695 AB +45 2505 3907.00 17120780+4539587 M061 3959 16311879+4051516 M062 16555-0820 A 152751 644 A 428 43800 200168 82817 5642-1503-1 43039 AB -08 4352 3845.00 16552880-0820103 M062 16555-0820 B 152751 644 B 428 43800 200168 82817 5642-1503-1 43039 AB -08 4352 3845.00 16552880-0820103 M062 16555-0820 C 643 427 43797 82809 5642-1583-1 43039 C 3844.00 16552527-0819207 M062 16555-0820 D 644 C 429 43802 3845.00 16553529-0823401 M063 625 42804 80459 3878-1193-1 3740.03 16252459+5418148 M064 1128 271 09424635-6853060 M065 1156 324 2835.01 12185939+1107338 M066 3877 3003 38829 3372.03 14563831-2809473 M067 408 6193 25946 53767 1978-1286-1 2561.00 11000432+2249592 M068 829 508 51370 106106 1668-637-1 5177.00 21293671+1738353 M069 3522 6158 08585633+0828259 M070 402 294 25500 53020 261-224-1 2524.00 10505201+0648292 M071 216899 880 533 55339 142008 113296 1711-2453-1 +15 4733 5563.00 22563497+1633130 M072 299 35 1942.00 08115757+0846220 M073 03019-1635 A 3193 B 9672 710203 14101 5865-694-1 6616 A -17 588 03015142-1635356 M073 03019-1635 B 3192 A 9671 14101 03015107-1635306 M073 03019-1635 C 3192 A 14101 03015142-1635356 M074 1068 22 04102815-5336078 M075 20532+6210 A 199305 809 3595 50124 22451 103096 4251-655-1 56840 A +61 2068 5012.00 20531977+6209156 M076 393 2272 24467 156874 51317 246-1068-1 +01 2447 2456.00 10285555+0050275 M077 4063 46690 3109-1699-1 18343664+4007266 M078 1286 546 5703.11 23351050-0223214 M079 4053 3376 4228.11 18185725+6611332 M080 54872 22480446-2422075 M081 4274 3799 53683 5413.01 22230696-1736250 M082 4248 3746 22022935-3704512 M083 3991 44290 83945 3084-558-1 3899.01 17093153+4340531 M084 1224 3359 45963 4142.01 18073292-1557464 M085 3378 1805 1373.01 06011106+5935508 M086 109 1439 8817 12781 1772-986-1 555.00 02441537+2531249 M087 514 352 34287 129864 65859 895-317-1 +11 2576 3079.00 13295979+1022376 M088 3207 1513 03113519-3847233 M089 2005 1070 1292 66.01 00244419-2708242 M090 1093 223 17247 1635.01 06592868+1920577 M091 165222 701 3356 45883 201375 88574 5100-282-1 -03 4233 4133.00 18050755-0301523 M092 480.1 340 31495 61874 7783-576-1 2919.00 12404633-4333595 M093 54 1208 3945 775222 5496 8855-238-1 -68 47 -68 41 246.00 01102281-6726425 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

M094 21313-0947 A 831 A 511 51428 106255 5790-1233-1 5184.00 21311859-0947263 M094 21313-0947 B 831 B 106255 5790-1233-1 5184.00 21311859-0947263 M095 382 23680 193190 49986 4907-704-1 -03 2870 2395.11 10121768-0344441 M096 300 1989 19136 1953.10 08124088-2133056 M097 793 3558 49417 101180 4241-32-1 4889.00 20303207+6526586 M098 16240+4821 A 623 417 42730 80346 3495-601-1 3733.00 16240913+4821112 M099 06578-4417 A 257 A 222 17239 33499 7640-1099-1 17304 B -44 3045 1641.10 06574663-4417281 M099 06578-4417 B 257 B 33499 7640-1099-2 17304 A 1641.10 06574663-4417281 M100 686 452 45173 133635 86287 1555-1029-1 +18 3421 4009.00 17375330+1835295 M101 1289 4003 5741.21 23430628+3632132 M102 07401183-4257406 M103 493.1 2664 2981.02 13003350+0541081 M104 19075+3231 H 747 A 471 47437 4459.00 19074283+3232396 M104 19075+3231 I 747 B 4459.00 19074283+3232396 M105 11381671-7721484 M106 1151 316 2739.01 11505787+4822395 M107 1227 465 4238.01 18222719+6203025 M108 48 131 3359 4856 4304-700-1 +70 68b 202.00 01023213+7140475 M109 1105 1963 18699 38956 2968-1142-1 1875.01 07581269+4118134 M110 1230 A 3405 4313.01 18410977+2447143 M110 1230 B 3404 4313.01 18410977+2447143 M111 16201-3732 A 618 A 415 42493 747653 80018 7853-670-1 41675 A -37 10765 3701.00 16200353-3731449 M111 16201-3732 B 618 B 416 42494 80018 3701.00 16200321-3731485 M112 486 341 31933 62452 882-1111-1 2943.00 12475664+0945050 M113 232 1846 16474 1484.00 06244132+2325585 M114 1154 AB 2531 2817.01 12141654+0037263 M115 3146 1375 7501 464.01 02162977+1335136 M116 1057 168 665.01 03132299+0446293 M117 3454 07362513+0704431

K001 03329-0927 A 22049 144 1557 11207 1084 185905 16537 5296-1533-1 7579 A -09 697 742.00 03325591-0927298 K002 21069+3844 A 201091 820 A 62 50559 8085 86045 104214 3168-2800-1 57584 A +38 4343 5077.00 21065341+3844529 K002 21069+3844 B 201092 820 B 63 50560 8086 86049 104217 3168-2798-1 57584 B +38 4344 5077.00 21065473+3844265 K003 209100 845 67 52724 8387 349918 108870 8817-984-1 -57 10015 5314.00 22032156-5647093 K003 22041052-5646577 K004 202560 825 66 50917 301208 105090 7966-1201-1 -39 14192 -39 8920 5117.00 21171534-3852022 K005 10114+4927 A 88230 380 280 23613 51736 49908 3437-811-1 28452 A +50 1725 2390.00 10112218+4927153 K006 04153-0739 A 26965 166 A 23 12863 1325 400061 19849 5312-2325-1 8980 A -07 780 945.00 04151651-0739068 K006 04153-0739 B 26976 166 B 24 12868 -07 781 945.00 04152173-0739173 K006 04153-0739 C 166 C 25 12869 945.00 04152173-0739173 K007 18055+0230 A 165341 702 A 458 45899 6752 165145 88601 434-5213-1 46270 A +02 3482 4137.00 18052735+0229585 K007 18055+0230 B 702 B 459 45900 88601 434-5212-1 46270 B 4137.00 18052735+0229585 K008 14574-2124 A 131977 570 A 387 38872 5568 263609 73184 6180-855-1 38678 A -20 4125 3375.00 14572788-2124526 K008 14574-2124 B 131976 570 B 386 38871 263608 73182 6180-1230-1 38678 B -20 4123 -20 6021 3375.00 14572643-2124384 K009 17155-2635 A 155886 663 A 437 44415 6402 266613 84405 6820-326-1 43835 A -26 12026 -26 5858 3908.00 17152095-2636064 K009 17155-2635 B 155885 663 B 438 44416 6401 84405 6820-326-2 43835 B 3908.00 17152095-2636064 K009 17155-2635 C 156026 664 439 44446 266626 84478 6820-293-1 43835 C -26 12036 -26 5863 3913.00 17161340-2632444 K010 20112-3605 A 191408 783 A 486 48832 7703 299890 99461 7453-1391-1 54025 A -36 13940 4782.00 20111207-3606063 K010 20112-3605 B 783 B 487 99461 4782.00 20111207-3606063 K011 09144+5241 A 79210 338 A 260 21249 32059 45343 3806-1814-1 25914 A +53 1320 2198.00 09142298+5241125 K011 09144+5241 B 79211 338 B 261 21251 32060 120005 3806-1819-1 25914 B +53 1321 2198.00 09142485+5241118 K012 191849 784 3531 48880 325963 99701 8392-2673-1 -45 13677 -45 9899 4794.00 20135335-4509506 K013 23132+5709 A 219134 892 71 56173 8832 41599 114622 4006-1866-1 63405 A +56 2966 5616.00 23131692+5710059 K014 02361+0653 A 16160 105 A 15 8447 753 145742 12114 52-1686-1 5772 A +06 398 520.00 02360498+0653140 K014 02361+0653 B 105 B 16 8455 520.00 02361535+0652191 K015 17190-3459 A 156384 667 A 442 44531 6426 296186 84709 7370-850-1 43999 A -34 11626 3924.00 17185698-3459236 K015 17190-3459 B 667 B 442 44531 296186 84709 7370-850-2 43999 B 3924.00 17185698-3459236 K015 17190-3459 C 667 C 443 44534 3924.00 17185868-3459483 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

K016 00483+0516 A 4628 33 121 2668 222 143910 3765 17-1398-1 1972 A +04 123 156.00 00482303+0516497 K017 01425+2016 A 10476 68 1287 5685 493 91014 7981 1211-1733-1 3895 A +19 279 356.00 01422977+2016073 K018 01080+5455 A 6582 53 A 8 3721 321 26046 5336 3673-1929-1 2746 A +54 223 219.00 01081597+5455148 K018 53 B 219.00 01081597+5455148 K019 216803 879 55315 8721 303193 113283 7505-100-1 -32 17321 -32 6550 5562.00 22562403-3133559 K020 01398-5612 A 10361 66 A 487 331230 7751 8478-1394-2 3804 A -56 329 352.00 01394778-5611361 K020 01398-5612 B 10360 66 B 5588 486 331230 7751 8478-1394-1 3804 B -56 329 352.00 01394755-5611471 K021 157881 673 447 44767 163976 85295 405-956-1 +02 3312 3955.00 17254521+0206406 K022 217357 884 3885 55523 274478 113576 6971-95-1 -23 17699 -23 8259 5572.00 23001607-2231276 K023 05025-2115 A 32450 185 A 14415 248358 23452 5912-481-1 10632 A -21 1051 -21 727 1135.00 05022845-2115236 K023 05025-2115 B 185 B 14415 23452 5912-481-2 10632 B 1135.00 05022845-2115236 K024 32147 183 200 14351 1614 187577 23311 4762-1490-1 -05 1123 1129.00 05004896-0545117 K025 06523-0511 A 50281 250 A 1875 17107 189627 32984 4808-939-1 16878 A -05 1844 1606.00 06521806-0510253 K025 06523-0511 B 250 B 1876 4808-765-1 16878 B 1606.00 06521804-0511241 K026 17191-4638 A 156274 666 A 444 44524 6416 322809 84720 8341-4366-1 44003 A -46 11370 3919.00 17190373-4638109 K026 17191-4638 B 666 B 445 44525 84720 8341-4365-1 44003 B 3919.00 17190292-4638134 K027 192310 785 488 48922 7722 270900 99825 6914-1943-1 -27 14659 -27 6972 4804.00 20151734-2701585 K028 103095 451 A 44 28839 4550 76134 57939 3014-574-1 +38 2285 2745.00 11525880+3743060 K029 11345-3250 A 100623 432 A 308 27854 4458 289079 56452 7220-866-1 31760 A -32 8179 -32 3122 2678.00 11342953-3249533 K029 11345-3250 B 432 B 309 27855 2678.00 K030 16363-0220 A 149661 631 3224 43164 6171 179865 81300 5052-996-1 42318 A -01 3220 3773.00 16362142-0219281 K031 151288 638 43504 79608 82003 2585-1313-1 +33 2777 3815.00 16450635+3330330 K032 122064 35851 5256 18804 68184 4171-1430-1 +62 1325 13573203+6129343 K033 232979 172 1688 13604 29269 21553 3732-542-1 +52 857 1010.00 04374092+5253372 K034 103932 453 319 29099 259689 58345 6674-576-1 -26 8883 -26 4626 2762.00 11575619-2742251 K035 17925 117 9195 857 212115 13402 5292-897-1 -13 544 599.00 02523210-1246109 K036 111631 488 32069 178892 62687 4950-67-1 +00 2989 2951.00 12504357-0046047 K037 17051-0504 A 154363 653 431 44127 200318 83591 5072-408-1 43409 A -04 4225 3878.00 17050345-0503584 K037 17051-0504 B 654 432 44131 83599 5072-1232-1 43409 B -04 4226 3880.00 17051383-0505385 K038 13445 86 13 7238 637 331669 10138 8048-1022-1 -51 532 -51 282 445.00 02102587-5049258 K039 16167+6715 A 147379 617 A 3175 42488 19804 79755 4195-721-1 41546 A +67 935 3712.00 16164280+6714196 K039 16167+6715 B 617 B 3176 42489 79762 4195-1167-1 41546 B 3712.00 16164537+6715224 K040 23526+7532 A 223778 909 A 58239 9038 11788 117712 4602-552-1 64926 A +74 1047 5772.00 23522534+7532403 K040 23526+7532 B 909 B 117712 5772.00 23522534+7532403 K041 519 34676 77312 66459 2543-201-1 +36 2393 3116.10 13372875+3543039 K042 17393+0333 A 160346 688 45197 164368 86400 419-1909-1 +03 3465 4016.00 17391691+0333190 K043 11507 79 1307 6302 244400 8768 5858-74-1 -23 693 -23 215 392.00 01524908-2226055 K044 166620 706 3363 46046 6806 81007 88972 3102-1975-1 +38 3095 4171.00 18093745+3827288 K045 00394+2115 A 3651 27 1116 2118 166 90012 3093 1193-2072-1 1630 A +20 85 110.00 00392187+2115024 K046 13169+1701 A 115404 505 A 2713 33527 129708 64797 1451-1151-1 35292 A +17 2611 3035.00 13165106+1701021 K046 13169+1701 B 505 B 2714 33528 64797 1451-1154-1 35292 B 3035.00 13165156+1701000 K047 74576 320 20139 285567 42808 7675-3469-1 -38 4789 -38 2615 2089.00 08431805-3852569 K048 85512 370 2201 22790 314743 48331 7706-1752-1 -42 5678 -42 4101 2340.00 09510700-4330097 K049 08555+7048 A 75632 325 A 256 20460 43820 4378-2162-1 25030 A +71 482 2113.00 08552479+7047389 K049 08555+7048 B 325 B 257 20463 43820 4378-2162-2 25030 B +71 482a 2113.00 08552479+7047389 K050 00057+4548 A 38 4 A 1016 172 42555 473 3246-874-1 227 A +45 4408 4.00 00054091+4548435 K050 00057+4548 B 38 4 B 1017 173 42555 473 3246-874-2 227 B +45 4408s 4.00 00054090+4548374 K050 00057+4548 F 2 1014 139 428 3246-1142-1 227 F +44 4548 4.00 00051079+4547116 K051 245409 208 121171 26335 709-63-1 +11 878 1281.01 05363099+1119401 K052 222237 902 3994 57525 375763 116745 9345-214-1 -73 1672 -73 2299 5721.00 23393736-7243197 K053 14534+1909 A 131511 567 5279 38694 5553 130966 72848 1481-694-1 +19 2881 3367.00 14532374+1909104 K054 125072 542 2892 36884 342746 69972 8690-554-1 -58 5564 -58 5467 3243.00 14190485-5922447 K055 15009+4526 A 572 39083 54474 73470 3481-1481-1 38794 AB +45 2247 3394.00 15005557+4525343 K055 15009+4526 B 572 39083 54474 73470 3481-1481-1 38794 AB +45 2247 3394.00 15005557+4525343 K056 11110+3028 A 97101 414 A 2367 26534 54646 2520-2524-1 30943 A +31 2240 2600.00 11110509+3026459 K056 11110+3028 B 414 B 2366 26531 2520-2456-1 30943 B +31 2238a 2600.00 11110245+3026415 K057 196877 798 496 49687 102186 8791-434-1 -53 8617 -53 9928 4924.00 20421878-5241572 K058 05413+5329 A 37394 211 1774 15439 1925 29972 26779 3749-1334-1 12482 A +53 934 1289.00 05412033+5328523 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

K058 05413+5329 B 233153 212 1775 15446 29975 26801 3749-996-1 12482 B +53 935 1291.00 05413073+5329239 K059 101581 435 2441 28235 316653 56998 7753-1657-1 -43 7228 -43 5524 2701.00 11410247-4424184 K060 08526+2820 A 75732 324 A 2062 20414 3522 99117 43587 1949-2012-1 24879 A +28 1660 2117.00 08523579+2819509 K060 08526+2820 B 324 B 2063 20418 2117.00 08524084+2818589 K061 03279-1948 A 21531 142 1548 10996 212935 16134 5876-955-1 -20 643 -20 390 724.00 03275236-1948165 K062 158633 675 3287 44822 6518 20362 85235 4210-849-1 +67 1014 3972.00 17250019+6718246 K063 190007 775 169210 98698 498-2720-1 +02 4076 4746.00 20024703+0319344 K064 82106 349 2147 21909 400140 46580 234-468-1 +06 2182 2256.00 09295482+0539184 K065 40307 355061 27887 8892-1247-1 -60 1303 -60 508 05540421-6001245 K066 05284-0331 A 36003 204 1763 15135 188091 25623 4757-1577-1 11868 A -03 1110 1242.00 05282613-0329576 K067 27274 167 1650 12938 333341 19884 8502-1080-1 -53 889 -53 672 950.00 04155689-5318353 K068 166348 707 46063 323841 89211 7912-268-1 -43 12343 -43 8486 4166.00 18122138-4326411 K069 11214-2027 A 98712 425 A 27132 258886 55454 6090-1204-1 31286 A -19 3242 -19 4829 2632.01 11212663-2027134 K069 11214-2027 B 425 B 27131 55454 6090-1204-2 31286 B 2632.01 11212655-2027095 K070 13454+1746 A 525 359 35101 67090 1463-985-1 36269 C +18 2776 3133.00 13450502+1747105 K071 29697 174 13741 93689 21818 1279-1854-1 +20 802 1039.00 04411888+2054058 K072 128165 556 37762 34579 71181 3860-1045-1 +53 1719 3299.01 14332887+5254315 K073 170657 716 46596 234645 90790 6274-1576-1 -18 4986 -18 414 4256.00 18311897-1854314 K074 13491+2659 A 120476 528 A 6259 35353 102871 67422 2002-492-1 36407 A +27 2296 3153.00 13490399+2658469 K074 13491+2659 B 528 B 6259 35353 67422 2002-492-2 36407 B 3153.00 13490401+2658447 K075 11247-6139 A 99279 428 A 2402 27330 358692 55691 8959-1969-2 31408 A -60 3532 -60 2911 2645.00 11244030-6138512 K075 11247-6139 B 99279 428 B 2402 27330 358692 55691 8959-1969-1 31408 B -60 3532 -60 2911 2645.00 11243947-6138542 K076 211970 1267 53616 350185 110443 8822-210-1 -55 9073 -55 9831 22221621-5433383 K077 214749 868 54520 274115 111960 6969-1175-1 -30 19255 -30 6663 5486.00 22404335-2940278 K078 10436 69 1291 5703 13209 8070 4040-104-1 +63 229 354.00 01434072+6349242 K079 22496 146 1563 11339 307774 16711 8063-834-1 -48 1011 -48 376 754.00 03350093-4825089 K080 154577 656 3268 44221 362534 83990 9052-1691-1 -60 6576 -60 6718 3884.00 17101032-6043434 K081 471 2570 30983 158926 61094 874-452-1 +09 2636 2885.00 12311578+0848380 K082 215 1782 15533 27188 4098-1836-1 +62 780 1303.10 05454821+6214132 K083 08364+6718 A 310 251 19805 16691 42220 4133-241-1 +67 552 2037.00 08362561+6717419 K084 145417 615 413 42227 344701 79537 8719-359-1 -57 6303 -57 7690 3669.00 16134869-5734118 K085 184489 763 3470 47956 168166 96285 486-4483-1 +04 4157 4583.00 19343982+0434572 K086 10454+3831 A 400 A 75444 52600 3009-2043-1 29915 Aa +39 2376 2509.10 10452148+3830422 K086 10454+3831 B 400 B 75444 52600 3009-2043-1 29915 Aa +39 2376 2509.10 10452148+3830422 K087 23356 11720 213316 17420 5877-700-1 -19 733 -19 395 03435531-1906394 K088 216133 875 206835 112774 5241-1613-1 -07 5871 5527.00 22501943-0705245 K089 5133 42 1163 2941 276466 4148 6998-1282-1 -31 325 -31 92 177.00 00530108-3021249 K090 07400-0336 A 61606 282 A 18257 190509 37349 4835-546-1 20442 A -03 2001 1809.00 07395932-0335506 K090 07400-0336 B 282 B 18260 190510 4835-774-1 20442 B -03 2002 1809.00 07400289-0336130 K090 18149 36985 4834-1644-1 -02 2198 07360708-0306385 K091 234078 532 35516 53781 67691 3467-367-1 +50 2030 3166.01 13515995+4957033 K092 110315 481 31530 129246 61901 1446-1139-1 +16 2404 2922.02 12410647+1522359 K093 173818 726 47001 202137 92200 5118-441-1 -03 4380 4334.01 18472725-0338232 K094 150689 295424 81935 7867-1845-1 -38 11173 -38 6514 16441502-3856371 K094 16453-3848 A 150848 748022 82021 7867-1905-1 42674 A -38 11189 -38 6524 16451697-3848332 K094 16453-3848 B 150848 748022 82021 7867-1905-1 42674 A -38 11189 -38 6524 16451697-3848332 K095 120467 529 363 35368 262129 67487 6135-445-1 -21 3781 -21 5613 3154.00 13494500-2206392 K096 546 2903 37102 70218 2014-591-1 +30 2512 3262.00 14215724+2937468 K097 334 20989 192035 44722 5445-823-1 -08 2582 2175.01 09064536-0848248 K098 16049+3909 A 144579 611 A 3152 41938 79018 78775 3061-1027-1 +39 2947 3650.00 16045689+3909234 K098 16049+3909 B 611 B 3150 41931 3649.01 16045093+3909359 K099 281 18233 37288 183-626-1 +02 1729 1803.01 07392304+0211012 K100 07175-4659 A 57095 269 A 1911 17683 311660 35296 8123-1534-1 18811 A -46 3046 -46 1360 1722.00 07172953-4658457 K100 07175-4659 B 269 B 1911 17683 311660 35296 8123-1534-2 18811 B 1722.00 07172953-4658457 K101 205390 833 51629 349539 106696 8436-504-1 -51 12998 -51 11696 5198.00 21364123-5050433 K102 11153+7328 A 97584 420 A 26722 7880 54952 4398-328-1 31089 A +74 456 2611.00 11151198+7328308 K102 11153+7328 C 420 B 26719 54952 4398-328-2 31089 C 2611.00 11151105+7328360 K103 13477-3226 A 120036 1177 A 67308 7270-974-1 36359 A -31 10649 13474215-3225480 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

K103 13477-3226 B 1177 B 67308 7270-974-2 36359 B 13474283-3225509 K104 52698 259 17311 251442 33817 6527-3498-1 -25 3913 -25 1829 1646.10 07011370-2556555 K105 144628 613 42064 344621 79190 8718-1921-1 -56 6221 -56 7345 3652.00 16094280-5626430 K106 142709 604 41579 321230 78170 7846-245-1 -42 10934 -42 7253 3602.00 15574075-4237271 K107 19305 123 1496 9886 146240 14445 55-745-1 +01 543 642.00 03062676+0157538 K108 116 159 9148 13375 2334-540-1 +33 529 588.00 02520697+3423236 K109 118926 521.1 2773 34824 196744 66675 4970-1243-1 -03 3508 3121.00 13400715-0411101 K110 06262+1845 A 45088 233 AB 16509 122473 30630 1336-16-1 15019 A +18 1214 1489.00 06261024+1845249 K110 06262+1845 B 233 AB 16509 30630 1336-16-1 15019 A 1489.00 06261024+1845249 K111 12442+5146 A 110833 483 31724 33702 62145 3458-2234-1 +52 1650 2933.00 12441457+5145336 K112 23328-1650 A 221503 898 57183 241792 116215 6403-455-1 64153 A -17 6769 5695.00 23324936-1650441 K112 23328-1650 B 897 A 57180 241790 116191 6403-1115-1 64153 BC -17 6768 5695.00 23324655-1645081 K112 23328-1650 C 897 B 57180 116191 6403-1115-1 64153 BC 5695.00 23324655-1645081 K113 52 136 3643 12736 5247 4025-626-1 +63 137 217.00 01070794+6356284 K114 218511 1279 55957 366273 114361 9338-287-1 -68 2331 -68 3561 23094094-6743581 K115 14 1053 853 1368 2786-906-1 +40 45 45.00 00170635+4056538 K116 21054+0704 A 200779 818 3624 50492 171251 104092 538-1647-1 57480 A +06 4741 5070.00 21051974+0704092 K117 05287-6527 A 36705 354779 25647 8887-1611-1 11876 A -65 332 -65 475 05284484-6526551 K117 05287-6527 B 05284446-6526463 K118 00021-6817 A 224953 1294 A 58834 351584 169 9134-1714-1 88 A -68 2373 -68 3594 00020875-6816509 K118 00021-6817 B 1294 B 58834 169 9134-1714-2 88 B 00020939-6816534 K119 06372-5002 B 240 16786 31634 8112-1978-2 15754 B 1556.00 06371122-5002181 K119 06372-5002 A 240 16786 767032 31634 8112-1978-1 15754 A -49 2340 -49 990 1556.00 06371122-5002181 K120 05192-0305 A 34673 200 A 1754 14867 187932 24819 4756-223-1 11411 A -03 1061 1211.00 05191260-0304256 K120 05192-0305 B 200 B 1755 14868 187932 24819 4756-223-2 11411 B 1211.00 05191260-0304256 K121 08427+0933 A 319 A 2042 20087 42748 810-2829-1 24351 A +10 1857 2078.00 08424455+0933240 K121 08427+0933 B 319 B 2042 20087 42748 810-2829-1 2078.00 08424455+0933240 K121 08427+0933 C 319 C 2043 20092 42762 810-1030-1 24351 C 2078.00 08425223+0933111 K122 21197 141 1546 10867 185743 15919 4715-1106-1 -05 642 712.00 03245975-0521489 K123 03575-0110 A 24916 157 A 12237 175417 18512 4718-32-1 8401 A -01 565 873.00 03572871-0109338 K123 03575-0110 B 157 B 12236 18512 4718-32-2 8401 B 873.00 03572892-0109232 K124 156 5087 12153 186324 18280 4724-682-1 -07 699 865.00 03543546-0649342 K125 19167-4553 A 179930 750 A 47589 324943 94739 8375-1985-1 50371 AB -46 12902 -46 9672 4482.00 19164290-4553213 K125 19167-4553 B 179930 750 B 47589 324943 94739 8375-1985-1 50371 AB -46 12902 -46 9672 4482.00 19164290-4553213 K126 139763 40839 230572 76779 6189-359-1 -17 4399 15403455-1802566 K127 00516-2255 A 4967 40 A 1159 2857 243325 4022 6422-1073-1 2088 A -23 332 -23 101 173.00 00513400-2254361 K127 00516-2255 B 40 B 1160 2859 173.00 00513516-2254307

G001 14396-6050 A 128620 559 A 50 37984 5459 360911 71683 9007-5849-1 38060 A -60 5483 3309.00 G001 14396-6050 B 128621 559 B 51 37985 5460 71681 9007-5848-1 38060 B 3309.00 G001 14396-6050 C 551 49 37460 70890 3278.00 14294291-6240465 G002 01441-1557 A 10700 71 146 5787 509 210580 8102 5855-2292-1 3967 A -16 295 365.00 01440402-1556141 G003 19322+6941 A 185144 764 477 47961 7462 21580 96100 4448-2481-1 51348 A +69 1053 4607.00 19322153+6939413 G004 00491+5749 A 4614 34 A 123 2690 219 25718 3821 3663-2669-1 1998 A +57 150 155.00 00490622+5748545 G004 00491+5749 B 34 B 122 3821 3663-2669-2 1998 B 155.00 00490516+5749037 G005 20794 139 19 10637 1008 307533 15510 7567-1183-1 -43 1028 -43 354 703.00 03195563-4304112 G006 14513+1906 A 131156 566 A 5544 130930 72659 1481-722-1 38468 A +19 2870 3360.00 14512328+1906034 G006 14513+1906 B 566 B 72659 1481-722-2 38468 B 3360.00 14512328+1906034 G007 12337+4121 A 109358 475 2579 31117 4785 53064 61317 3020-2541-1 33836 Aa +42 2321 2895.00 12334454+4121270 G007 12337+4121 B 109358 475 2579 31117 4785 53064 61317 3020-2541-1 33836 Aa +42 2321 2895.00 12334454+4121270 G008 13185-1818 A 115617 506 349 33614 5019 227091 64924 6116-1517-1 35348 A -17 3813 3039.00 13182443-1818387 G009 05544+2017 A 39587 222 AB 15782 2047 95062 27913 1320-2118-1 +20 1162 1354.00 05542300+2016344 G010 13118+2753 A 114710 502 348 33217 4983 102444 64394 1996-2400-1 35104 A +28 2193 3015.00 13115238+2752411 G011 03194+0321 A 20630 137 10577 996 146448 15457 59-1947-1 7169 A +02 518 691.00 03192169+0322126 G012 11465-4030 A 102365 442 A 311 28512 4523 316766 57443 7745-1381-1 32161 A -39 7301 2725.00 11463107-4030013 G012 11465-4030 B 442 B 313 28513 2725.00 11463269-4029476 G013 11411+3412 A 101501 434 28222 4496 76016 56997 2525-2445-1 31984 A +35 2270 2699.00 11410301+3412064 G014 01477+6351 A 10780 75 1297 5921 511 13257 8362 4040-2023-1 4118 A +63 238 371.00 01474488+6351090 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

G015 43834 231 16264 2261 369060 29271 9176-987-1 -74 374 1468.00 06101448-7445107 G016 02170+3414 A 13974 92 154 7508 660 67162 10644 2318-1874-1 5133 A +33 395 464.00 02170303+3413278 G017 09357+3549 A 82885 356 A 2156 22117 3815 74631 47080 2500-1533-1 26907 A +36 1979 2280.00 09353959+3548366 G017 09357+3549 B 356 B 2156 22117 74631 47080 2500-1533-1 26907 A 2280.00 09353959+3548366 G018 03180-6232 A 20807 138 172 10597 1010 353441 15371 8863-1557-1 7135 Aa -62 265 705.00 03181281-6230230 G018 03180-6232 B 20766 136 171 10575 1006 353436 15330 8863-1556-1 7135 B -63 217 701.00 03174616-6234313 G019 141004 598 3113 41151 5868 161899 77257 364-1224-1 +07 3023 3570.00 15462661+0721109 G020 00021+2706 A 224930 914 A 101 58829 9088 89344 171 1732-2731-1 90 A +26 4734 5807.00 00021014+2704570 G020 00021+2706 B 914 B 101 58829 89344 171 1732-2731-1 90 A 5807.00 00021014+2704570 G021 72673 309 249 19772 3384 285366 41926 7135-2774-1 -31 6229 -31 2448 2042.00 08325148-3130031 G022 69830 302 245 19296 3259 219933 40693 5435-2991-1 -12 2449 1977.00 08182389-1237541 G023 05192+4007 A 34411 197 1753 14837 1729 47977 24813 2900-2157-1 11406 A +39 1248 1199.00 05190848+4005565 G024 14412 95 1387 7651 683 244874 10798 6433-2414-1 -26 828 -26 214 479.00 02185853-2556451 G025 15038+4739 A 133640 575 A 39209 5618 73695 3484-1580-1 38892 A +48 2259 3410.00 15034736+4739152 G025 15038+4739 B 575 B 39210 400199 73695 3484-1580-2 38892 B 3410.00 15034736+4739152 G026 01418+4237 A 10307 67 1284 5629 483 44319 7918 2823-2455-1 3875 A +41 328 350.00 01414714+4236483 G026 01418+4237 B 10307 67 1284 5629 483 44319 7918 2823-2455-1 3875 A +41 328 350.00 01414714+4236483 G027 147513 620.1 A 6094 295007 80337 7853-621-1 -38 10983 -38 6407 3717.00 16240128-3911346 G027 620.1 B 295000 80300 7853-559-1 -38 10980 -38 6406 3715.01 16233382-3913461 G028 172051 722 6998 268697 91438 6279-1723-1 -21 5081 4289.01 18385342-2103065 G029 30495 177 13953 1532 214826 22263 5892-1953-1 -17 954 1070.00 04473628-1656041 G030 00065+2900 A 166 5 235 8 89410 544 1735-927-1 269 A +28 4704 9.00 00063674+2901175 G031 22183-5338 A 211415 853 A 3790 53420 8501 350135 110109 8822-1455-1 61042 A -54 10055 5395.00 22181562-5337372 G031 22183-5338 B 853 B 3790 53420 350135 110109 8822-1455-1 61042 A 5395.00 22181562-5337372 G032 16156-0822 A 146233 616 3171 42344 6060 199464 79672 5613-1378-1 41514 A -07 4242 3687.00 16153726-0822096 G033 95128 407 25907 4277 52175 53721 3009-2703-1 +41 2147 2556.00 10592802+4025485 G034 17351+6152 A 160269 684 A 3305 45144 6573 20453 86036 4199-1513-1 44750 A +61 1678 4013.00 17345954+6152290 G034 17351+6152 B 684 B 3305 45144 20453 86036 4199-1513-2 44750 B 4013.00 17345954+6152290 G034 17351+6152 C 685 3306 45156 86087 4199-693-1 4017.00 17353445+6140540 G035 17206+3229 A 157214 672 441 44643 6458 80145 84862 2596-1317-1 44076 A +32 2896 3946.00 17203955+3228056 G036 72905 311 3391 16705 42438 4133-1971-1 +65 643 2047.10 08391162+6501151 G037 196761 796 3570 49644 7898 271457 101997 6921-1792-1 -24 16193 -24 7050 4911.00 20401173-2346262 G038 15439+0230 A 140538 596.1 A 5853 161850 77052 355-1288-1 40313 A +02 2989 15440182+0230548 G038 15439+0230 B 596.1 B 77052 15440182+0230548 G039 136352 582 395 39962 5699 320504 75181 8298-1229-1 -47 9919 -47 7075 3462.00 15214824-4819032 G040 10010+3155 A 86728 376 2216 23166 3951 74920 49081 2503-1516-1 +32 1964 2366.00 10010072+3155262 G040 10005030+3155459 G041 00458-4733 A 4391 1021 2525 209 305219 3583 8034-1159-1 1881 A -48 176 -48 82 146.01 00454561-4733072 G041 00458-4733 B 146.01 00454435-4732567 G042 38858 1085 15661 2007 188472 27435 4776-1306-1 -04 1244 1330.11 05483495-0405404 G043 15475-3755 A 140901 599 A 5299a 41167 5864 294265 77358 7837-930-1 40466 A -37 10500 -37 6571 3567.00 15472911-3754587 G043 15475-3755 B 599 B 5299b 41169 3567.00 G044 00373-2446 A 3443 25 A 118 2012 159 243033 2941 6421-1924-2 1552 B -25 225 104.00 00372057-2446023 G044 00373-2446 B 3443 25 B 118 2012 159 243033 2941 6421-1924-1 1552 A -25 225 -25 64 104.00 00372057-2446023 G045 41593 227 121913 28954 1313-1343-1 +15 1065 1406.00 06064047+1532317 G046 05075+1839 A 32923 188 A 1736 14515 1656 120619 23835 1286-403-1 10841 A +18 779 1152.00 05072692+1838420 G046 05075+1839 B 32923 188 B 1736 14515 1656 120619 23835 1286-403-1 10841 A +18 779 1152.00 05072692+1838420 G047 160691 691 45314 6585 346258 86796 8355-436-1 -51 11094 -51 10535 4027.00 17440870-5150027 G048 217014 882 55385 8729 114985 113357 1717-2193-1 +19 5036 5568.00 22572795+2046077 G049 182488 758 47754 7368 82821 95319 2658-2556-1 +32 3411 4539.00 19233402+3313190 G050 13237+0243 A 116442 3781 A 33954 159721 65352 303-1283-1 35538 A +03 2765 13233916+0243239 G050 13237+0243 B 116443 3782 B 33956 159722 65355 303-1282-1 35538 B +03 2766 13234086+0243309 G051 20036+2954 A 190360 777 A 3510 48652 7670 110318 98767 2153-2883-1 53464 A +29 3872 4759.00 20033732+2953493 G051 20036+2954 B 777 B 3509 48646 4756.00 20032651+2952000 G052 15527+4227 A 142373 602 3127 41439 5914 55019 77760 3057-2021-1 +42 2648 3596.00 15524052+4227052 G053 21483-4718 A 207129 838 52100 8323 327579 107649 8437-31-1 59654 A -47 13928 -47 9758 5262.00 21481574-4718129 G054 17304-0104 A 158614 678 A 44914 6516 180083 85667 5080-2188-1 44529 A -00 3300 3970.00 17302380-0103459 G054 17304-0104 B 678 B 44914 85667 5080-2188-2 44529 B 3970.00 17302380-0103459 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

G055 07518-1354 A 64096 291 A 18547 3064 219300 38382 5423-3227-1 21276 A -13 2267 1856.00 07514629-1353526 G055 07518-1354 B 291 B 18547 38382 5423-3227-2 21276 B 1856.00 07514629-1353526 G056 43162 3389 2225 250051 29568 6505-2273-1 -23 3577 -23 1125 06134528-2351433 G057 111395 486.1 31976 4864 102174 62523 1990-3779-1 +25 2568 2945.00 12484706+2450250 G058 04053+2201 A 25680 160 12493 1262 93234 19076 1262-1646-1 8659 A +21 587 902.00 04052023+2200321 G059 07039-4336 A 53705 264.1 A 17382 2667 311421 34065 7641-1530-1 17808 A -43 2906 -43 1186 1662.00 07035734-4336289 G059 07039-4336 B 53706 264.1 B 17383 2668 311423 34069 7641-2180-1 17808 B -43 2907 -43 1186 1662.00 07035890-4336411 G059 07039-4336 C 53680 264 17380 311415 34052 7641-558-1 17808 C -43 2904 -43 1184 1660.00 07035022-4333410 G060 177565 744 47394 7232 298566 93858 7917-565-1 -37 13049 -37 8466 4433.00 19065247-3748380 G061 14035+1047 A 122742 538 36119 5273 130282 68682 904-1278-1 +11 2625 3201.00 14033235+1047121 G062 62613 290 5130 18520 2997 1316 38784 4535-1164-1 +80 238 1829.00 07561720+8015558 G063 126053 547 2907 37152 5384 160580 70319 318-438-1 +01 2920 3264.00 14231528+0114294 G064 16011+3318 A 143761 606.2 3145 41765 5968 78975 78459 2576-2228-1 40963 A +33 2663 3626.00 16010264+3318124 G065 50692 252 2569 96740 33277 1898-2479-1 +25 1496 1613.02 06551867+2522320 G066 152391 641 426 43724 179951 82588 5051-1354-1 +00 3593 3837.00 16525877-0001356 G067 15533+1312 A 142267 3924 3131 41435 5911 131776 77801 955-1148-1 40678 A +13 3024 3595.00 15531211+1311489 G068 76151 327 20504 3538 191823 43726 4873-1792-1 -04 2490 2130.00 08541798-0526040 G069 102438 446 28549 4525 289357 57507 7217-698-1 -29 9337 -29 3538 2728.00 11471583-3017113 G070 1237 3021 824 366856 1292 9354-780-1 -80 9 -80 7 00161266-7951042 G071 165185 702.1 6748 297246 88694 7403-6261-1 -36 12214 -36 7995 4132.01 18062370-3601113 G072 21072-1355 A 200968 819 A 50550 238393 104239 5783-1074-1 57610 A -14 5936 5076.00 21071037-1355224 G072 21072-1355 B 819 B 50550 104239 5783-1511-1 57610 B 5076.00 21071038-1355262 G073 13168+0925 A 115383 504 33523 5011 159616 64792 891-624-1 35287 A +10 2531 3034.00 13164653+0925269 G074 193664 788 3537 49062 7783 22081 100017 4245-1794-1 +66 1281 4849.00 20173128+6651130 G075 165499 705.1 45984 6761 363177 89042 9059-2661-1 -62 5797 4139.00 18102614-6200078 G076 15138-0121 A 135204 580 A 393 39643 179510 74537 5001-567-1 39232 A -00 2944 3438.00 15135096-0121047 G076 15138-0121 B 135204 580 B 393 39643 179510 74537 5001-567-1 39232 A -00 2944 3438.00 15135096-0121047 G077 189567 776 484 48618 7644 364390 98959 9098-1638-1 -67 2385 -67 3703 4738.00 20053286-6719156 G078 20040+1705 A 190406 779 3515 48662 7672 137550 98819 1621-1499-1 53498 A +16 4121 4760.00 20040620+1704125 G079 11268+0300 A 99491 429 A 2407 27398 4414 157865 55846 267-1191-1 31472 A +03 2502 2648.00 11264531+0300475 G079 11268+0300 B 99492 429 B 2408 27399 157866 55848 267-1200-1 31472 B +03 2503 2648.00 11264627+0300229 G080 206860 836.7 51984 8314 140575 107350 1133-1258-1 +14 4668 5246.10 21443131+1446190 G081 15233+3018 A 137107 584 A 40103 5727 78550 75312 2563-1366-1 39584 A +30 2653 3480.00 15231232+3017162 G081 15233+3018 B 137108 584 B 5728 75312 2563-1366-2 39584 B 3480.00 15231232+3017162 G082 42807 230 16236 2208 122109 29525 734-2214-1 +10 1050 1435.00 06131250+1037374 G083 21198-2621 A 202940 825.4 A 3655 51024 8148 272343 105312 6945-785-1 58338 A -26 15541 -26 7193 5129.00 21194564-2621100 G083 21198-2621 B 825.4 B 3656 51025 272343 105312 6945-1195-1 58338 B 5129.00 21194564-2621100 G084 130948 564 5534 103620 72567 2016-334-1 +24 2786 3352.10 14501581+2354424 G085 39091 9189 208 15535 2022 376576 26394 9386-2614-1 -80 195 -80 161 1340.00 05370988-8028090 G086 84737 368 22625 3881 51497 48113 3433-1531-1 +46 1551 2316.00 09483533+4601155 G087 222335 902.1 57549 304038 116763 7518-129-1 -33 16646 -33 6374 5723.00 23395129-3244358 G088 154345 651 3260 44092 55871 83389 3501-1373-1 +47 2420 3877.00 17023639+4704540 G089 4747 36 1154 2748 243283 3850 6421-822-1 -23 315 -23 95 162.00 00492678-2312447 G090 20052+3829 A 190771 1249 48704 7683 84163 98921 3150-3061-1 53576 A +38 3896 4767.30 20050978+3828424 G091 181321 755 7330 298894 95149 7432-2718-1 -35 13422 -35 8542 19212974-3459002 G092 01332-2411 A 9540 59 A 5178 244072 7235 6426-1229-1 3557 A -24 658 -24 173 322.00 01331578-2410405 G092 01332-2411 B 59 B 5160 01330002-2414586 G093 52711 262 1893 17339 2643 400099 34017 1907-321-1 +29 1441 1647.00 07033043+2920150 G094 78366 334.2 21037 3625 74277 44897 2495-846-1 +34 1949 09085105+3352556 G095 36435 204.1 354767 25544 8879-151-1 -60 1169 -60 424 1254.00 05273934-6024575 G096 06172+0505 A 43587 231.1 A 16334 2251 150225 29860 140-1840-1 14476 A +05 1168 1463.00 06171614+0506001 G097 120690 530 2814 35448 5209 262173 67620 6720-1406-1 -23 11328 -23 5802 3161.00 13512039-2423252 G098 194640 790 3554 49277 300210 100925 7455-1420-1 -31 17597 -31 6268 4864.00 20274424-3052039 G099 157347 6465 180049 85042 5071-891-1 -02 4343 17225127-0223173 G100 09143+6125 A 79028 337.1 3648 16969 45333 4135-1915-1 +62 1058 2192.00 09142054+6125239 G101 136923 40078 131343 75277 1490-157-1 +19 2961 15224688+1855081 G102 22583-0224 A 217107 8734 206984 113421 5235-1468-1 62816 A -03 5539 22581556-0223432 G102 22583-0224 B 217107 8734 206984 113421 5235-1468-1 62816 A -03 5539 22581556-0223432 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

G103 14294+8049 A 128642 3859 2539 70857 4565-800-1 +81 482 14292223+8048355 G104 15282-0921 A 137763 586 A 40292 198631 75718 5595-1153-1 39755 A -08 3981 3491.00 15280961-0920525 G104 15282-0921 B 137778 586 B 40296 198632 75722 5595-1154-1 39755 B -08 3983 3491.00 15281221-0921279 G105 128400 3863 372367 71855 9428-1001-1 -74 917 -74 1218 14415245-7508221 G106 180161 1233 6346 47547 37189 94346 3928-1729-1 +57 1961 4485.00 19121135+5740192 G107 22266-1644 A 212698 859 A 53842 8545 240280 110778 6385-1461-1 61409 A -17 6521 5421.00 22263425-1644310 G107 22266-1644 B 212697 859 B 53842 8544 110778 6385-683-1 61409 B -17 6520 5421.00 22263425-1644310 G108 10189+4403 A 89269 3593 23953 51812 50505 3007-67-1 28754 A +44 1973 2416.00 10185193+4402544 G109 09123+1459 A 79096 337 A 2114 21191 3650 126206 45170 825-1543-1 25815 A +15 2003 2193.00 09121762+1459454 G109 09123+1459 P 79096 337 B 2114 21191 3650 126206 45170 825-1543-1 25815 A +15 2003 2193.00 09121762+1459454 G109 09121469+1459396 G110 21247-6814 A 203244 1262 51140 365154 105712 9322-1132-1 -68 2223 -68 3418 21244063-6813402 G111 03545+1637 A 24496 3255 12133 119451 18267 1249-1065-1 8295 A +16 527 03542799+1636582 G111 03545+1637 B 18267 03542799+1636582 G112 184385 47935 109204 96183 1613-392-1 +21 3822 19332555+2150256 G113 22249-5748 A 212330 857 53743 8531 350219 110649 8828-1420-1 61341 A -58 8327 -58 7954 5415.00 22245638-5747508 G114 9407 59.1 5181 13081 7339 4297-1087-1 +68 113 318.00 01343317+6856535 G115 18803 120.2 9664 92163 14150 1790-948-1 +26 503 628.01 03022598+2636334 G116 12590-0950 A 112758 491 A 2656 32493 196027 63366 5536-983-1 34662 A -09 3595 2974.00 12590162-0950029 G116 12590-0950 B 491 B 2656 32493 196027 63366 5536-983-1 34662 A 2974.00 12590162-0950029 G117 20408+1956 A 197076 797 A 49682 7914 138820 102040 1642-835-1 56073 A +19 4484 4932.00 20404512+1956071 G117 20408+1956 C 797 B 4932.00 G118 00228-1212 A 1835 17.3 1171 88 208709 1803 5265-757-1 950 A -13 60 62.00 00225174-1212340 G119 76932 3523 20676 3578 220890 44075 6014-255-1 -15 2656 2150.00 08584388-1607583 G120 19418+5031 A 186408 765.1 A 48136 7503 37671 96895 3565-1524-1 51966 A +50 2847 4634.00 19414896+5031305 G120 19418+5031 B 186427 765.1 B 48138 7504 37673 96901 3565-1525-1 51966 B +50 2848 4634.00 19415198+5031032 G121 117043 511.1 34113 5070 18596 65530 4167-701-1 +64 949 3071.00 13255983+6315406 G122 16147+3352 A 146361 615.2 A 42337 6063 400215 79607 2583-1846-1 41482 A +34 2750 3689.00 16144084+3351307 G122 16147+3352 B 146362 615.2 B 42338 6064 79607 2583-1846-2 41482 B 3689.00 16144043+3351272 G122 615.2 C 42306 79551 2583-2153-1 3689.00 16135630+3346243 G123 124580 540.3 36689 5325 319343 69671 8277-3275-1 -44 9181 -44 6693 14153866-4500026 G124 04155+0612 A 26923 1322 147353 19859 80-874-1 8986 A +05 614 04152879+0611128 G124 04155+0612 B 26913 1321 147350 19855 80-204-1 8986 B +05 613 04152578+0611588 G125 141272 3917 3116 41229 161926 77408 352-286-1 +02 3001 3574.00 15480945+0134183

F001 07393+0514 A 61421 280 A 233 18229 2943 153068 37279 187-2184-1 20391 A +05 1739 1805.00 07391805+0513298 F001 07393+0514 B 280 B 233 18229 153068 37279 187-2184-1 20391 A 1805.00 07391805+0513298 F002 18211+7245 A 170153 713 AB 3379 46426 6927 9830 89937 4437-1491-1 47207 A +72 839 4245.00 18210342+7243582 F003 04499+0657 A 30652 178 14011 1543 148020 22449 96-1462-1 10147 A +06 762 1077.00 04495040+0657409 F004 11182+3132 A 98231 423 A 2390 26920 4375 400161 55203 2520-2634-1 31184 A +32 2132 2625.00 11181100+3131464 F004 11182+3132 B 98230 423 B 2391 26921 4374 400161 55203 2520-2634-2 31184 B 2625.00 11181100+3131464 F005 1581 17 5 1045 77 351761 1599 8843-1706-1 -65 13 54.00 00200446-6452282 F006 05445-2226 A 38393 216 A 15560 1983 249307 27072 5930-2197-1 12638 A -22 1211 -22 2438 -22 886 1316.00 05442780-2226538 F006 05445-2226 B 38392 216 B 15558 1982 249306 5930-2196-1 12638 B -22 1210 -22 2437 -22 885 1316.00 05442655-2225184 F007 203608 827 3674 51220 8181 365174 105858 9111-1423-1 -65 2751 -65 3918 5152.00 21262662-6521578 F008 03091+4936 A 19373 124 166 9973 937 45875 14632 3318-1840-1 6846 A +49 857 647.00 03090387+4936479 F009 11507+0146 A 102870 449 2465 28736 4540 158259 57757 273-924-1 32307 A +02 2489 2739.00 11504173+0145528 F010 02441+4913 A 16895 107 A 8789 799 45428 12777 3304-2737-1 6057 A +48 746 549.00 02441197+4913423 F010 02441+4913 B 16895 107 B 8787 799 45428 12777 6057 A +48 746 549.00 02441025+4913540 F011 15564+1540 A 142860 603 408 41572 5933 131822 78072 1496-2119-1 40788 A +16 2849 3604.00 15562720+1539413 F012 33262 189 1674 334043 23693 8514-2291-1 -57 735 1164.00 05053067-5728217 F012 1075 334046 23708 8517-450-1 -57 1079 -57 737 1164.00 05054736-5733138 F013 22070+2520 A 210027 848 52972 8430 114048 109176 2208-2471-1 60528 A +24 4533 5345.00 22070067+2520424 F014 12417-0127 A 110379 482 A 2604 31564 4825 400177 61941 4949-1120-1 34064 A -00 2601 2924.00 12413962-0126580 F014 12417-0127 B 110380 482 B 2605 31565 4826 400177 61941 4949-1120-2 34064 B 2924.00 12413962-0126580 F015 21470-1607 A 207098 837 52065 8322 239339 107556 6363-1044-1 59595 A -16 5943 5258.00 21470244-1607382 F016 147584 624 42751 6098 373091 80686 9278-2951-1 -69 2558 3719.00 16282814-7005037 F017 15551-6326 A 141891 601 A 41426 5897 361732 77952 9027-5712-1 40744 A -63 3723 3589.00 15550857-6325507 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

F018 10306+5559 A 90839 395 24513 4112 32668 51459 3819-1373-1 29249 A +56 1459 2459.00 10303759+5558501 F018 10306+5559 B 237903 394 24505 32667 3819-1043-1 29249 B +56 1458 2457.00 10302530+5559569 F019 09329+5141 A 82328 354 A 270 21999 3775 32203 46853 3432-1451-1 26790 A +52 1401 2266.00 09325151+5140384 F019 09329+5141 B 354 B 46853 2266.00 09325151+5140384 F020 01367+4125 A 9826 61 5367 458 44216 7513 2822-2210-1 3685 A +40 332 331.00 01364784+4124200 F021 23399+0538 A 222368 904 3995 57557 8969 174312 116771 591-1744-1 64428 A +04 5035 5724.00 23395706+0537343 F022 22484 147 1569 11391 1101 146728 16852 64-1569-1 -00 572 753.00 03365238+0024054 F023 03121-2859 A 20010 127 A 1515 10215 963 245929 14879 6445-990-1 6930 A -29 1177 -29 362 664.00 03120443-2859156 F023 03121-2859 B 127 B 14879 6445-990-2 6930 B 664.00 03120443-2859156 F024 17206 111 8887 818 211940 12843 5866-1050-1 -19 518 560.00 02450616-1834211 F025 05244+1723 A 35296 202 15000 1780 120922 25278 1300-2225-1 11667 A +17 920 1224.00 05242545+1723006 F025 35171 201 14980 120905 25220 1300-284-1 +17 917 1222.00 05233836+1719267 F026 14252+5151 A 126660 549 A 6266 37312 5404 34508 70497 3478-1332-1 37641 A +52 1804 3274.00 14251181+5151029 F026 14252+5151 B 549 B 3274.00 14251160+5149535 F027 197692 805 7936 271590 102485 6925-1576-1 -25 15018 -25 7174 4947.00 20460572-2516153 F028 40136 225 2085 216474 28103 5360-1370-1 -14 1286 1370.00 05562429-1410036 F029 18570+3254 A 176051 738 A 47229 7162 82082 93017 2643-3345-1 49220 A +32 3267 4399.00 18570156+3254050 F029 18570+3254 B 738 B 93017 2643-3345-2 49220 B 4399.00 18570156+3254050 F030 105452 455.3 4623 259912 59199 6672-995-1 -24 10174 -24 4786 2796.00 12082481-2443440 F031 84117 364 22406 3862 256602 47592 6602-2081-1 -23 8646 -23 4656 2306.00 09421443-2354563 F032 7570 55 1220 4186 370 305721 5862 8033-1232-1 -46 346 -46 127 257.00 01151112-4531540 F033 63077 288 A 237 18413 3018 284390 37853 7114-2950-1 -33 4113 -33 1748 1841.00 07453500-3410226 F033 288 B 237a 18414 07453844-3355528 F034 16560+6508 A 153597 648 43914 6315 20129 82860 4197-2429-1 43087 C +65 1157 3860.00 16560170+6508054 F035 19254+0307 A 182640 760 47775 7377 167816 95501 469-6227-1 50902 A +02 3879 4542.00 19252990+0306532 F036 13473+1727 A 120136 527 A 35234 5185 130070 67275 1460-132-1 36349 A +18 2782 3144.00 13471581+1727249 F036 13473+1727 B 527 B 67275 3144.00 13471581+1727249 F037 18071+3034 A 165908 704 A 6775 80945 88745 2621-2683-1 46366 A +30 3128 4153.00 18070158+3033434 F037 18071+3034 B 704 B 88745 2621-2683-2 46366 B 4153.00 18070158+3033434 F038 4813 37 2785 235 209360 3909 5270-1139-1 -11 153 166.00 00500759-1038394 F039 14347+2945 A 128167 557 37785 5447 103421 71284 2021-1323-1 37926 A +30 2536 3300.00 14344080+2944422 F040 09007+4147 A 76943 332 A 2093 20721 3579 50954 44248 2986-1978-1 25270 AB +42 1956 2153.00 09003845+4146583 F040 09007+4147 B 76943 332 B 2093 20721 3579 50954 44248 2986-1978-1 25270 AB +42 1956 2153.00 09003845+4146583 F041 07578-6018 A 65907 294 A 1959 18763 3138 356380 38908 8911-793-1 21657 A -59 944 1902.00 07574692-6018111 F041 07578-6018 B 294 B 1960 776845 -59 1774 1902.00 07575485-6017584 F041 07578-6018 C 294 C 1902.00 07575485-6017584 F042 90589 391 4102 370700 50954 9223-2880-1 -73 576 -73 733 2451.00 10242373-7401536 F043 22467+1211 A 215648 872 A 3851 54819 8665 141833 112447 1155-2186-1 62306 A +11 4875 5516.00 22464156+1210228 F043 22467+1211 B 872 B 3852 54820 5516.00 22464232+1210214 F044 06467+4335 A 48682 245 2483 49322 32480 2953-1958-1 16485 A +43 1595 1571.00 06464434+4334385 F045 55575 1095 2721 49716 35136 3396-2196-1 +47 1419 1687.00 07155011+4714241 F046 17051 108 8800 810 332074 12653 8056-1164-1 -51 641 -51 330 557.00 02423346-5048008 F047 19064-3704 A 177474 743.1 A 47387 7226 298559 93825 7422-1737-1 49731 A -37 13048 4431.00 19062517-3703485 F047 19064-3704 B 177475 743.1 B 47387 7227 298559 93825 7422-1737-2 49731 B -37 13048 4431.00 19062517-3703485 F048 09291-0246 A 81997 348 A 3759 177880 46509 4885-1568-1 26592 A -02 2901 2255.00 09290891-0246083 F048 09291-0246 B 348 B 177881 4885-1567-1 26592 B -02 2902 09290922-0245027 F049 17210-2107 A 156897 670 A 44619 6445 266721 84893 6246-664-1 44097 A -20 4731 3935.00 17210038-2106463 F049 17210-2107 B 670 B 84893 3935.00 17210038-2106463 F050 110897 484 31760 4845 76701 62207 3021-2548-1 +40 2570 2935.00 12445938+3916441 F051 10647 3109 506 331261 7978 8475-527-1 -54 365 01422932-5344271 F052 139664 594 40843 5825 320883 76829 7849-3219-1 -44 10310 -44 7529 3536.00 15411138-4439401 F053 23754 155 1591 11847 1173 246687 17651 6448-1370-1 -23 1565 -23 414 827.00 03465090-2314585 F054 160915 692 6595 267190 86736 6260-2072-1 -21 4712 4034.00 17432580-2140593 F055 13100+1732 A 114378 501 A 33105 4968 129630 64241 1454-1134-1 35047 A +18 2697 3006.00 13095936+1731456 F055 13100+1732 B 114379 501 B 33105 4969 129630 64241 1454-1134-2 35047 B +18 2697 3006.00 13095936+1731456 F056 46588 240.1 1868 16831 2401 6423 32439 4534-1837-1 +79 212 1530.00 06461411+7933542 F057 07523-3442 A 64379 292 A 18577 3079 284526 38423 7127-2092-2 21314 A -34 4036 1864.00 07521555-3442199 F057 07523-3442 B 64379 292 B 18577 3079 284526 38423 7127-2092-1 21314 B -34 4036 -34 1776 1864.00 07521555-3442199 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

F058 07290+3147 A 58946 274 A 17908 2852 72843 36366 2452-2167-1 19646 A +32 1562 1760.00 07290671+3147043 F058 07290+3147 B 274 B 36366 1760.00 07290671+3147043 F058 17907 72839 36357 2456-932-1 +32 1561 1758.00 07290175+3159378 F059 14190-2549 A 125276 542.1 A 2891 36915 5356 262764 69965 6735-1289-1 37437 A -25 10271 -25 5397 3249.00 14190091-2548557 F059 14190-2549 B 542.1 B 69965 3249.00 14190091-2548557 F060 13142-5906 A 114837 503 AB 33318 4989 341714 64583 8661-2282-1 35215 A -58 4940 -58 4740 3017.00 13141513-5906114 F060 13142-5906 B 64583 3017.00 13141513-5906114 F061 69897 303 19323 3262 98601 40843 1936-1174-1 +27 1589 1979.00 08200385+2713038 F062 129502 9491 38172 5487 197840 71957 4997-942-1 -05 3936 3325.00 14430363-0539291 F063 109085 471.2 31021 4775 225971 61174 6103-2394-1 -15 3489 2887.00 12320424-1611455 F064 210302 849.1 53086 8447 302262 109422 7492-1465-1 -33 15941 -33 6227 5357.00 22100875-3232544 F065 19364+5013 A 185395 765 A 48025 7469 37578 96441 3564-3157-1 51619 A +49 3062 4611.00 19362654+5013155 F065 19364+5013 B 765 B 96441 4611.00 19362654+5013155 F066 21145+1001 A 202275 822 A 50842 8123 139808 104858 1109-2583-1 58037 AB +09 4746 5107.00 21142881+1000249 F066 21145+1001 B 202275 822 B 50842 8123 139808 104858 1109-2583-1 58037 AB +09 4746 5107.00 21142881+1000249 F067 07201+2159 A 56986 271 A 2777 97380 35550 1359-2672-1 18998 A +22 1645 1718.00 07200736+2158561 F067 07201+2159 B 56986 271 B 2777 97380 35550 1359-2672-1 18998 A +22 1645 1718.00 07200736+2158561 F068 00531+6107 A 5015 41 2903 244 12540 4151 4017-2318-1 2171 A +60 124 174.00 00530419+6107262 F069 693 10 524 33 208457 910 5839-1081-1 -16 17 24.00 00111587-1528043 F070 09307-4028 A 82434 351 A 21964 3786 314390 46651 7696-2620-1 26670 A -39 5580 -39 3651 2268.00 09304200-4028004 F070 09307-4028 B 351 B 21964 46651 7696-2620-2 26670 B 2268.00 09304200-4028004 F071 25457 159 12410 1249 175430 18859 4725-1276-1 -00 632 891.00 04023675-0016078 F072 19510+1025 A 187691 768.1 A 48319 7560 137097 97675 1062-2701-1 52634 A +10 4073 4670.00 19510166+1024567 F072 19510+1025 C 768.1 B 4670.00 19510068+1024400 F073 18457+2033 A 173667 725.2 46972 7061 107791 92043 1591-1918-1 48550 A +20 3926 4328.00 18453972+2032466 F074 06165+1216 A 43386 9207 16315 2241 122206 29800 739-2617-1 14423 A +12 1084 1459.00 06162660+1216194 F075 119756 525.1 35111 5168 291783 67153 7270-2399-1 -32 9603 -32 3479 3132.00 13454130-3302372 F076 15074+2453 A 134083 578 39355 5634 103802 73996 2024-1355-1 38997 A +25 2873 3416.00 15071805+2452094 F077 71243 305 3318 369878 40702 9398-2714-1 -76 507 2006.00 08183157-7655108 F078 12068-6437 A 105211 455.2 4616 359197 59072 8982-4970-1 32913 A -63 2145 2793.00 12065290-6436494 F079 21094-7310 A 200525 818.1 A 3635 50541 8061 374890 104440 9333-1274-1 57736 A -73 2192 5058.00 21092250-7310235 F079 21094-7310 B 200525 818.1 B 3635 50541 8061 374890 104440 9333-1274-1 57736 A -73 2192 5058.00 21092250-7310235 F079 21094-7310 C 818.1 C 50542 104440 5058.00 21092379-7310270 F080 68456 297.1 19067 3220 356535 39903 8924-2780-1 -60 2088 -60 1074 1946.00 08090068-6118088 F081 04406-4152 A 29875 174.1 A 1502 308904 21770 7589-1693-1 9855 A -42 1587 -42 513 1048.00 04403374-4151495 F081 04406-4152 B 174.1 B 21770 1048.00 F082 07299+4941 A 58855 9234 2849 49904 36439 3401-1647-1 19713 A +49 1630 1757.00 07295595+4940207 F083 21148+3803 A 202444 822.1 A 50860 8130 400283 104887 3169-3876-1 58064 A +37 4240 5114.00 21144746+3802429 F083 21148+3803 B 822.1 B 50860 400283 104887 3169-3876-2 58064 B 5114.00 21144746+3802429 F083 21148+3803 Q 822.1 C 6374 50859 5114.00 21144685+3801137 F084 09105+6707 A 78154 335 A 3616 16933 45038 4141-1496-1 25738 A +67 577 2174.00 09102351+6708030 F084 09105+6707 B 335 B 45038 4141-1496-2 25738 B 2174.00 09102351+6708030 F085 27290 167.1 1338 333343 19893 8075-1796-1 -51 1066 -51 524 952.00 04160159-5129119 F086 23167+5313 A 219623 4324 56351 8853 41654 114924 3998-2448-1 63542 A +52 3410 5633.00 23164228+5312489 F087 219482 1282 8843 366354 114948 9126-1745-1 -62 1444 -62 6412 23165765-6200043 F088 154417 654.1 44139 6349 163495 83601 398-1908-1 +00 3629 3881.00 17051682+0042090 F089 06148+1909 A 43042 3390 16267 2220 122160 29650 1322-1496-1 14316 A +19 1270 1449.00 06145088+1909229 F090 05227+7913 A 33564 196 1686 5936 25110 4532-2096-1 11573 C +79 169 1173.00 05223348+7913519 F091 25998 161.1 12608 1278 69137 19335 2877-1545-1 +37 882 911.00 04083660+3802230 F091 04075+3803 A 25893 12567 69110 19255 2877-247-1 8740 A +37 878 907.00 04073434+3804293 F091 04075+3803 B 12566 19255 2877-247-2 8740 B 907.00 04073434+3804293 F092 00352-0336 A 3196 23 A 1904 142 182410 2762 4675-1216-3 1459 AB -04 62 97.00 00351484-0335343 F092 00352-0336 B 23 B 1904 2762 4675-1216-3 1459 AB 97.00 00351484-0335343 F093 01157-6852 A 7788 55.3 A 4258 377 352298 5896 9136-1759-2 2988 A -69 52 -69 45 264.00 01154602-6852331 F093 01157-6852 C 7693 55.1 A 4206 352293 5842 9136-1758-1 2988 C -69 51 -69 44 261.00 01150082-6849081 F093 01157-6852 B 7788 55.3 B 4259 377 352298 5896 9136-1759-1 2988 B -69 52 -69 45 264.00 01154602-6852331 F093 01157-6852 D 55.1 B 5842 9136-1758-2 2988 D 261.00 01150082-6849081 F094 19465+3343 A 187013 767.1 A 48226 7534 83516 97295 2660-4227-1 52307 A +33 3587 4654.00 19462559+3343400 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

F094 19456+3336 A 186858 765.4 A 48207 97222 2660-31-1 52255 A +33 3582 4648.00 19453355+3336068 F094 19465+3343 B 225732 767.1 B 48228 83518 2660-4231-1 52307 B +33 3589 4654.00 19462754+3343496 F094 19456+3336 B 765.4 B 48207 97222 2660-31-2 52255 B 4648.00 19453355+3336068 F095 189245 773.4 48537 7631 299648 98470 7444-1240-1 -34 14082 -34 8561 4729.00 20002024-3342122 F096 739 3013 551 35 275790 950 6995-1262-1 -35 42 -35 16 27.00 00114399-3507593 F097 89449 388.1 24018 4054 127314 50564 1423-1351-1 +20 2466 2421.00 10194419+1928157 F097 23782 10145386+2022137 F097 23781 10145393+2022188 F098 55892 268.1 2740 311577 34834 8119-2547-1 -46 2977 -46 1284 1694.00 07123363-4645337 F099 160032 686.2 45187 6569 323240 86486 8351-2577-1 -49 11616 -49 10162 4008.00 17402381-4924560 F100 90089 392.1 4084 1804 51502 4632-2151-1 +83 297 2438.00 10310454+8233309 F101 03294-6256 A 22001 143.2 A 1551 11118 1083 353551 16245 8870-1384-1 7470 A -63 234 740.00 03292266-6256152 F101 03294-6256 B 143.2 B 1552 11119 775498 8870-1391-1 7470 B 740.00 03292904-6256478 F102 16673 3175 784 184889 12444 5285-1109-1 -10 525 02401242-0927103 F103 108954 4767 33593 61053 3841-1303-1 +53 1554 12305012+5304357 F104 10314-5343 A 91324 397.2 24602 4134 339127 51523 8601-4516-1 29283 A -53 3569 -53 3909 2468.00 10312180-5342556 F105 199260 811 8013 271828 103389 6931-1018-1 -26 15344 -26 7133 5007.01 20564731-2617470 F106 21442+2845 A 206826 836.6 A 51972 8309 400287 107310 2201-2078-1 59456 A +28 4169 5245.00 21440853+2844336 F106 21442+2845 B 206827 836.6 B 51973 8310 400287 107310 2201-2078-2 59456 B +28 4169 5245.00 21440853+2844336 F107 19598-0957 A 189340 773.3 5351a 48536 7637 203530 98416 5742-1060-1 53218 AB -10 5238 4733.00 19594734-0957293 F107 19598-0957 B 189340 773.3 5351a 48536 7637 203530 98416 5742-1060-1 53218 AB -10 5238 4733.00 19594734-0957293 F108 12152-1019 A 106516 322 30114 4657 225575 59750 5522-1684-1 33204 A -09 3468 2820.00 12151055-1018440 F109 08106-1348 A 68146 297.2 A 19073 3202 219748 40035 5438-2380-1 22475 A -13 2420 1939.00 08103984-1347575 F109 08106-1348 B 297.2 B 19072 1939.00 08103429-1348514 F110 03128-0112 A 19994 128 A 10224 962 175267 14954 4708-1423-1 6955 A -01 457 663.00 03124644-0111458 F110 03128-0112 B 128 B 14954 663.00 03124644-0111458 F111 213845 863.2 54210 8592 273980 111449 6392-1443-1 -21 6251 5458.00 22344161-2042293 F112 02412-0042 A 16765 8685 790 175164 12530 4699-1214-1 5966 A -01 377 543.00 02411398-0041442 F112 02412-0042 B 8685 12530 4699-1214-2 5966 B 543.00 02411398-0041442 F113 10172+2306 A 89125 387 A 23895 4039 100231 50384 1969-1262-1 28686 A +23 2207 2413.00 10171459+2306227 F113 10172+2306 B 387 B 50384 2413.00 10171410+2306264 F114 18138+6424 A 168151 708.1 46187 6850 20819 89348 4209-2018-1 46767 A +64 1252 4200.00 18135382+6423502 F115 17420+7209 A 162003 694.1 A 45387 6636 9604 86614 4436-1425-1 45056 A +72 804 4069.00 17415635+7208561 F115 17420+7209 B 162004 694.1 B 45388 6637 9605 86620 4436-1424-1 45056 B +72 805 4069.00 17415811+7209251 F116 18197-6353 A 167425 46224 6828 363269 89805 9076-497-1 47133 A -63 1343 -63 4370 4187.00 18194014-6353117 F116 18197-6353 B 89805 4187.00 18193998-6353040 F117 219571 9818 8848 350952 114996 8837-1297-1 -58 8062 5629.00 23172579-5814087 F118 17369+6845 A 160922 4017 45210 6596 20477 86201 4428-1960-1 44822 A +68 949 4036.00 17365709+6845282 F119 01495-1042 A 11171 9061 A 531 210688 8497 5278-2438-1 4186 A -11 352 382.00 01493510-1041110 F119 01495-1042 B 11131 9061 B 210682 8486 5278-2439-1 4186 B -11 351 382.00 01492335-1042125 F120 11387+4506 A 101177 433.2 A 2437 28087 4486 52553 56809 3452-1883-1 31898 A +45 1947 2695.00 11384487+4506303 F120 11387+4506 B 433.2 B 2436 28086 52552 56809 3452-1883-2 31898 B +45 1947p 2695.00 11384408+4506270 F121 11317+1422 A 100180 3669 A 27657 4437 128323 56242 862-1208-1 31655 A +15 2345 2665.00 11314496+1421525 F121 11317+1422 B 3670 B 27656 128322 56242 862-1209-1 31655 B +15 2345p 2665.00 11314443+1422059 F122 01144-0755 A 7439 54.2 A 4123 366 183194 5799 5273-2653-1 2944 A -08 216 253.00 01142403-0755222 F122 01144-0755 B 7438 54.2 B 4121 183193 5273-2652-1 2944 B -08 215 253.00 01142243-0754393 F123 190422 7674 348276 99137 8780-47-1 -55 8393 -55 9317 20073510-5500578 F124 00490+1656 A 4676 34.1 2716 225 116793 3810 1188-1686-1 1996 A +16 76 159.00 00485869+1656266 F125 164259 699.2 6710 201297 88175 5100-600-1 -03 4217 4109.00 18002899-0341250 F126 22426-4713 A 214953 871 A 54606 8635 328535 112117 8446-1645-1 62131 A -47 14307 -47 9895 5493.00 22423689-4712383 F126 22426-4713 B 871 B 54607 112117 5493.00 22423749-4712426 F127 11239+1032 A 99028 27257 4399 400162 55642 858-1221-1 31385 A +11 2348 2640.00 11235546+1031459 F127 11239+1032 B 27257 400162 55642 858-1221-2 31385 B 2640.00 11235546+1031459 F127 858-720-1 31385 C 2640.00 11234995+1037079 F128 09315+6303 A 81937 3559 3757 17085 46733 4139-1304-1 26708 A +63 845 2253.00 09313170+6303427 F128 09315+6303 B 81937 3559 3757 17083 +63 845 2253.00 09312835+6303420 F129 111456 9417 4867 18377 62512 4162-1200-1 +61 1320 2946.00 12483942+6019115 F130 02396-1152 A 16620 105.4 A 8615 781 211811 12390 5288-1093-1 5900 AB -12 501 537.00 02393381-1152192 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

F130 02396-1152 B 16620 105.4 B 8615 781 211811 12390 5288-1093-1 5900 AB -12 501 537.00 02393381-1152192

A001 06451-1643 A 48915 244 A 219 16953 2491 217626 32349 5949-2777-1 16356 A -16 1591 1577.00 06450887-1642566 A001 06451-1643 B 244 B 219 16953 217626 32349 5949-2777-1 16356 A 1577.00 06450887-1642566 A002 19508+0852 A 187642 768 3490 48314 7557 168779 97649 1058-3399-1 52618 A +08 4236 4665.00 19504698+0852060 A003 18369+3847 A 172167 721 46746 7001 81558 91262 3105-2070-1 48054 A +38 3238 4293.00 18365633+3847012 A004 216956 881 55380 8728 274426 113368 6977-1267-1 -30 19370 -30 6685 5565.00 22573901-2937193 A005 11490+1433 A 102647 448 2462 28642 4534 128576 57632 870-988-1 32248 A +15 2383 2738.00 11490366+1434197 A006 07346+3153 A 60179 278 A 18087 2891 72938 36850 2457-2407-1 20046 A +32 1581 1785.00 07343598+3153184 A006 07346+3153 B 60178 278 B 18087 2890 72938 36850 2457-2407-2 20046 B +32 1581 1785.00 07343598+3153184 A006 07346+3153 C 278 C 18088 72940 2453-1918-1 20046 C +32 1582 1785.00 07343745+3152102 A007 08592+4803 A 76644 331 A 2084 20650 3569 50941 44127 3420-2149-1 25209 A +48 1707 2143.00 08591246+4802304 A007 08592+4803 B 331 B 2083 44127 2143.00 08591246+4802304 A007 08592+4803 C 331 C 44127 2143.00 08591246+4802304 A008 17349+1234 A 159561 681 45084 6556 133563 86032 1000-2508-1 +12 3252 4000.00 17345606+1233361 A009 21186+6236 A 203280 826 8162 22755 105199 4252-1870-1 58272 A +61 2111 5139.00 21183475+6235081 A010 14425-6459 A 128898 560 A 38064 5463 360934 71908 9015-1445-1 38164 A -64 2977 3313.00 14423039-6458305 A010 14425-6459 B 560 B 38065 3313.00 14422861-6458413 A011 11141+2032 A 97603 419 26691 4357 100996 54872 1439-2479-1 31047 A +21 2298 2614.00 11140651+2031258 A012 01546+2048 A 11636 80 553 91184 8903 1212-1935-1 4352 A +20 306 394.00 01543840+2048291 A013 115892 508.1 33743 5028 291265 65109 7275-2074-1 -36 8497 -36 5880 3048.00 13203582-3642443 A014 39060 219 2020 334622 27321 8099-1392-1 -51 1620 -51 774 1339.00 05471708-5103594 A015 141795 3921 5892 161966 77622 360-1226-1 +04 3069 3587.00 15504895+0428399 A016 38678 217.1 1998 216268 27288 5359-1778-1 -14 1232 1326.00 05465735-1449189 A017 118098 3792 34515 5107 179083 66249 4966-1366-1 +00 3076 3100.00 13344160-0035450 A018 15347+2643 A 139006 5793 104146 76267 2029-1690-1 +27 2512 3519.00 15344125+2642529 A019 17151+2451 A 156164 3995 AB 6410 105702 84379 2065-1930-1 43825 Aa +25 3221 3916.00 17150190+2450212 A019 17151+2451 B 84379 3916.00 17150190+2450212 A020 14508-1602 A 130841 564.1 5531 229372 72622 6155-1210-1 38452 A -15 3966 3351.00 14505274-1602302 A020 14508-1602 B 130819 563.4 5530 229365 72603 6155-1209-1 38452 B -15 3965 3350.00 14504122-1559498 A021 2262 20 100 304874 2072 7530-978-1 -44 101 -44 47 72.00 00261219-4340475 A022 197157 4158 7920 348821 102333 8419-1619-1 -52 11752 4933.00 20440233-5155155 A023 02433+0314 A 16970 106.1 A 8785 804 400042 12706 50-1721-1 6026 A +02 422 554.00 02431801+0314089 A023 02433+0314 B 106.1 B 8786 400042 12706 50-1721-2 6026 B 554.00 02431801+0314089 A023 106.1 C 8754 50-27-1 +02 418 548.00 02423253+0322259 A024 95418 9343 4295 32912 53910 3827-1079-1 +57 1302 2567.00 11015046+5622566 A025 08448-5442 A 74956 321.3 A 3485 337198 42913 8573-3571-1 24469 A -54 1788 2098.00 08444223-5442313 A026 12155+5702 A 106591 459 4660 33469 59774 3837-1070-1 33209 A +57 1363 2824.00 12152554+5701575 A027 05596+4457 A 40183 3375 2088 48617 28360 2924-2742-1 13403 A +44 1328 1373.00 05593172+4456508 A028 13240+5456 A 116656 3783 A 5054 34007 65378 3850-1385-1 35543 A +55 1598 3062.00 13235563+5455292 A028 13240+5456 B 116656 3783 A 5054 34007 65378 3850-1385-1 35543 A +55 1598 3062.00 13235563+5455292 A028 13240+5456 D 116842 3785 5062 34021 65477 3850-1384-1 35543 C +55 1603 3066.00 13251353+5459165 A028 13240+5456 C 116657 3784 B 5055 65378 3850-1386-1 35543 B 3062.00 13235629+5455183 A029 11249-1741 A 99211 4405 224369 55705 6088-2155-1 31416 A -16 3244 2644.00 11245298-1741025 A029 11249-1741 B 55705 2644.00 11245298-1741025 A030 19055+1352 A 177724 4095 AB 7235 135773 93747 1052-3027-1 49678 A +13 3899 4436.00 19052461+1351486 A030 19055+1352 B 93747 4436.00 A031 157792 673.1 6486 266866 85340 6825-462-1 -24 13337 -24 5895 3954.00 17262221-2410308 A032 103287 4554 33292 58001 3833-1034-1 +54 1475 2749.00 11534983+5341408 A033 02449+1007 A 17094 9099 8864 813 118503 12828 643-937-1 6083 A +09 359 558.00 02445655+1006510 A033 02449+1007 B 17094 9099 8864 813 118503 12828 643-937-1 6083 A +09 359 558.00 02445655+1006510 A034 18073+0934 A 165777 9615 A 6771 165207 88771 1012-1661-1 46386 A +09 3564 4147.00 18072099+0933497 A034 18073+0934 C 9615 B 4147.00 18071949+0934016 A035 12299-1631 A 108767 30918 4757 225920 60965 6103-2395-1 33713 A -15 3482 2880.00 12295187-1630552 A035 12299-1631 B 30916 225919 6103-2398-1 -15 3481 2880.00 12295091-1631147 A036 19026-2953 A 176687 7194 269230 93506 6885-2837-1 49519 AB -30 16575 -30 5798 4415.00 19023670-2952484 A036 19026-2953 B 176687 7194 269230 93506 6885-2837-1 49519 AB -30 16575 -30 5798 4415.00 19023670-2952484 A037 17104-1544 A 155125 656.1 A 6378 232699 84012 6232-1333-1 43627 A -15 4467 3895.00 17102267-1543298 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

A037 17104-1544 B 656.1 B 84012 6232-1333-2 43627 B 3895.00 17102267-1543298 A038 18978 121 919 245730 14146 6438-1110-1 -24 1387 -24 358 633.00 03022353-2337281 A039 180777 748.1 7312 10093 94083 4583-2836-1 +76 717 4497.00 19090990+7633380 A040 05079-0506 A 33111 9175 1666 187729 23875 4759-1671-1 10861 A -05 1162 1158.00 05075100-0505109 A041 210418 9771 53109 8450 172728 109427 565-1999-1 +05 4961 5362.00 22101198+0611522 A042 87696 378.3 3974 75005 49593 2509-1343-1 +35 2110 2378.01 10072573+3514409 A043 172555 7012 363559 92024 9077-2487-1 -64 3948 4302.00 18452691-6452165 A043 782148 9077-2489-1 -64 1208 -64 3950 4302.00 18453704-6451460 A044 70060 1109 3270 285071 40706 7134-2967-1 -36 4449 -36 2235 1981.00 08183332-3639333 A045 78209 3534 3619 32016 44901 3430-1673-1 +52 1365 09085226+5136168 A046 18470+1811 A 173880 7069 135215 92161 1587-2067-1 48637 A +18 3823 4336.00 18470124+1810531 A047 04173+2035 A 27045 1329 93391 19990 1272-1126-1 9039 A +20 724 04171566+2034433 A047 284336 93394 1272-156-1 +20 727 04172693+2033178 A048 14162+5122 A 125161 9474 A 36813 5350 34432 69713 3478-1333-1 37339 A +52 1784 3245.00 14160992+5122019 A048 14162+5122 B 234121 9474 B 36814 34433 3478-418-1 37339 B +52 1785 3245.00 14161217+5122346 A049 50241 248 17061 2550 355624 32607 8899-2202-1 -61 720 1605.10 06481145-6156290 A050 22038+6437 A 209790 52854 8417 400291 108917 4271-2620-1 60369 A +63 1802 5333.00 22034716+6437407 A050 22038+6437 B 209791 52851 108917 4271-2619-1 60369 B +63 1802 5333.00 A051 21199-5327 A 202730 9733 A 8140 349299 105319 8793-1478-1 58345 A -53 10037 5122.00 21195196-5326581 A051 21199-5327 B 9733 B 105319 8793-1479-1 58345 B -53 10037 5122.00 21195120-5326583 A052 17322+5511 A 159560 6555 36043 85829 3892-1621-1 44627 A +55 1945 3999.00 17321602+5510224 A052 17322+5511 B 159541 6554 36040 85819 3892-1620-1 44627 B +55 1944 3999.00 17321055+5511033 A053 125162 3837 36818 5351 54024 69732 3472-1264-1 +46 1949 3246.00 14162308+4605177 A054 01259+6014 A 8538 4718 403 12969 6686 4031-3289-1 3334 A +59 248 287.00 01254889+6014070 A055 135379 580.1 5670 343590 74824 8706-1061-1 -58 5875 3443.10 15173088-5848043 A056 07181+1632 A 56537 9231 A 2763 123822 35350 1346-1396-1 18843 A +16 1443 1708.00 07180560+1632255 A056 07181+1632 B 9231 B 35350 1708.00 07180597+1632336 A057 88955 4023 315161 50191 7716-3704-1 -41 5713 -41 4418 2407.00 10144416-4207189 A058 22313+5017 A 213558 8585 40777 111169 3628-3193-1 61630 A +49 3875 5449.00 22311751+5016571 A059 161868 6629 164596 87108 420-1962-1 +02 3403 4065.00 17475355+0242262 A060 06377+1624 A 47105 2421 122774 31681 1329-1746-1 15777 A +16 1223 1539.00 06374273+1623574 A061 188228 7590 374450 98495 9315-1893-1 -73 2086 4694.00 20003558-7254380 A062 09368-4921 A 83446 3836 314504 47175 8176-2817-1 26968 A -48 4836 -48 2562 2288.00 09364955-4921181 A063 222603 57693 8984 174348 116928 586-1458-1 +00 5037 5734.00 23420281+0146481 A064 20320 984 185579 15197 5295-1259-1 -09 624 678.00 03155001-0849109 A065 15278+2906 A 137909 5747 104044 75695 2032-1605-1 39743 A +29 2670 3495.00 15274972+2906202 A065 15278+2906 B 137909 5747 104044 75695 2032-1605-1 39743 A +29 2670 3495.00 15274972+2906202 A066 12021+4304 A 104513 29357 4594 52766 58684 3019-2030-1 32716 A +43 2179 2774.00 12020684+4302443 A067 14055 664 67170 10670 2318-1875-1 +33 397 468.00 02171888+3350500 A068 10332+4026 A 91312 4132 51942 51658 3005-1206-1 29369 A +41 2101 2466.00 10331388+4025316 A069 12560+3819 A 112413 32338 4915 76815 63125 3021-2645-1 34542 A +39 2580 2969.00 12560168+3819059 A069 12560+3819 B 112412 32336 4914 76814 63121 3021-2646-1 34542 B +39 2580p 2969.00 12560044+3818533 A070 02020+7054 A 12111 575 4877 9480 4315-2126-1 4632 A +70 153 412.00 02015742+7054253 A070 02020+7054 B 9480 4315-2126-2 4632 B 412.00 02015742+7054253 A070 02020+7054 C 02020114+7054392 A071 109536 4794 317605 61468 7762-1974-1 -40 7376 -40 5805 2903.00 12354554-4101190 A072 04548+1009 A 31295 1570 120382 22845 688-1867-1 10337 A +09 683 04545372+1009030 A073 02398-4254 A 16754 789 306963 12413 7558-987-1 5911 A -43 814 542.00 02394796-4253300 A073 02398-4254 B 542.00 02394829-4253049 A074 79439 3541 3662 32078 45493 3806-1813-1 +54 1285 2199.03 09161131+5401186 A075 25490 1251 147155 18907 79-1585-1 +05 581 892.00 04030936+0559214 A076 110411 4828 129256 61960 878-1102-1 +11 2485 12415305+1014082 A077 17093 812 118504 12832 643-936-1 +11 377 557.10 A078 184006 7420 37459 95853 3555-2112-1 +51 2605 4570.00 19294236+5143472 A079 102124 4515 158171 57328 864-1209-1 +09 2545 2714.00 11451703+0815292 A080 19014+4656 A 177196 7215 57761 93408 3545-3041-1 49459 A +46 2602 4425.00 19012637+4656055 A081 06237+0436 A 44769 2298 150415 30419 141-2452-1 14860 A +04 1236 1482.00 06234609+0435339 A081 06237+0436 B 44770 2299 30422 141-2451-1 14860 B +04 1237 1482.00 06234648+0435449 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

A082 71155 3314 191324 41307 4857-2151-1 -03 2339 2003.00 08253963-0354231 A083 09188+3648 A 80081 3690 400135 45688 2499-1655-1 26130 A +37 1965 2214.00 09185060+3648091 A083 09188+3648 B 45688 2499-1655-2 26130 B 2214.00 09185060+3648091 A084 78045 333.3 3615 357086 44382 8939-2729-1 -65 1065 2172.00 09022678-6623460 A085 178253 7254 298624 94114 7917-2653-1 -38 13350 -38 7723 4450.00 19092834-3754157 A086 02095+3459 A 13161 622 67012 10064 2317-1647-1 4895 A +34 381 439.00 02093261+3459143 A087 95608 4300 100837 53954 1436-1306-1 +20 2547 2572.00 11021980+2010472 A088 11456-6644 A 102249 4520 358955 57363 8985-3045-1 32129 A -66 1640 11453643-6643433 A089 215789 9796 8675 350542 112623 8453-1499-1 -51 13389 -51 11870 5521.00 22483329-5119006 A090 00568+3830 A 5448 269 65785 4436 2798-1667-1 2301 A +37 175 189.00 00564522+3829578 A091 137898 5746 161607 75761 337-843-1 +02 2965 3494.00 15283822+0150315 A092 165040 6745 363162 88866 9059-3655-1 -63 4292 4130.00 18083481-6340069 A093 12415-4858 A 110304 31539 4819 317697 61932 8240-2724-1 34059 A -48 7597 -48 4965 2922.00 12413103-4857350 A093 12415-4858 B 31539 61932 8240-2724-2 34059 B 2922.00 12413103-4857350 A093 12405680-4904019 A094 49434 2514 176439 32617 4800-2674-1 -01 1386 06481907-0119079 A095 109787 31322 4802 317627 61622 8236-3158-1 -47 7745 -47 5588 2908.00 12374217-4832284 A096 17054+1245 A 154494 6355 132989 83613 984-2436-1 43424 A +12 3142 3882.00 17052271+1244268 A097 16278-0822 A 148367 6129 199688 80628 5626-1388-1 41977 AB -08 4243 3739.00 16274816-0822182 A097 16278-0822 B 148367 6129 199688 80628 5626-1388-1 41977 AB -08 4243 3739.00 16274816-0822182 A097 148300 199680 5626-979-1 -08 4241 16272891-0834192 A097 199677 5626-1249-1 -08 4240 16272238-0827588 A098 85376 3900 99911 48390 1961-1429-1 +25 2169 2333.00 09515300+2423438 A099 01112+5508 A 6961 3919 343 26092 5542 3673-1923-1 2850 A +54 236 241.00 01110616+5508596 A100 20501+4404 A 198639 7984 60544 102843 3179-1248-1 56668 A +43 3739 4984.00 20500494+4403334 A101 130109 5511 160949 72220 326-1426-1 +02 2862 3340.00 14461493+0153344 A102 146624 6070 265379 79881 6805-1909-1 -28 12037 -28 5311 3693.00 16181789-2836502 A103 1404 68 65183 1473 2273-2081-1 +35 44 51.00 00181967+3647070 A104 90132 24220 4086 287637 50888 7709-2840-1 -37 6509 -37 4123 2439.00 10232927-3800354 A105 19107 925 185352 14293 5294-1195-1 -08 572 637.00 03041650-0736032 A106 210049 8431 302229 109285 7492-1466-1 -33 15922 -33 6221 5346.00 22082300-3259184 A107 18068-4325 A 165189 6749 323736 88726 7911-5035-1 46359 A -43 12272 -43 8434 18064990-4325297 A107 18068-4325 B 165190 6750 88726 7911-5035-2 46359 B -43 8434 18064990-4325297 A108 06324-0552 A 46304 2386 189280 31167 4810-2632-1 15417 A -05 1678 06322312-0552076 A108 06324-0552 B 31167 06322340-0552078 A109 23489-2808 A 223352 9016 275366 117452 6988-1337-1 64778 A -28 18353 -28 7721 5760.00 23485554-2807490 A109 23489-2808 C 223340 275365 6987-1162-1 64778 C -28 18352 -28 7720 5760.00 23485048-2807157 A109 23489-2808 B 117452 6988-1337-1 64778 A 5760.00 23485554-2807490 A110 89021 4033 51795 50372 3007-1286-1 +43 2005 2411.00 10170583+4254515 A111 123998 5303 377662 69896 9439-1501-1 -80 706 14181388-8100282 A112 02292+6725 A 15089 707 400038 11569 4058-1504-1 5547 A +66 213 493.00 02290394+6724084 A112 02292+6725 B 11569 4058-1504-2 5547 B 493.00 02290394+6724084 A112 02292+6725 C 11569 4058-1505-1 5547 C 493.00 02290508+6724055 A113 23281 1139 213312 17395 5306-1181-1 -10 729 03433384-1029083 A114 04306+1611 A 28527 170.1 1427 119967 21029 1265-1169-1 9515 A +15 637 996.00 04303362+1611383 A114 04306+1611 B 28568 119973 21053 1265-763-1 9515 B +15 640 996.02 04304677+1608554 A115 37594 1940 188321 26624 4771-1201-1 -03 1166 05393115-0333528 A116 20146+3647 A 192640 7736 84530 99770 2683-3962-1 54308 A +36 3955 4812.00 20143203+3648225 A117 197950 7945 22346 102253 4258-2188-1 +66 1318 4957.00 20431101+6639267 A118 15008 97.1 705 352886 11001 9144-1688-1 -69 113 492.00 02214494-6839338 A119 212728 8547 365818 110935 9124-1805-1 -68 3493 22283770-6729205 A120 186219 7498 374368 97534 9314-780-1 -72 2445 4631.00 19492531-7230119 A121 222345 8968 241928 116758 5836-978-1 -15 6471 5722.00 23394707-1413198 A122 06424+1739 A 48097 2466 122905 32104 1334-2419-1 +17 1357 06422431+1738430 A123 22315-3221 A 213398 8576 302699 111188 7497-1511-1 61639 A -32 17126 -32 6506 5444.00 22313033-3220458 A123 22315-3221 B 302700 7497-1512-1 61639 B -32 17127 -32 6506 22313064-3221159 A124 16035-5747 A 143474 5961 344521 78662 8718-2860-1 41069 AB -57 6235 -57 7500 3620.00 16033208-5746304 A124 16035-5747 B 143474 5961 344521 78662 8718-2860-1 41069 AB -57 6235 -57 7500 3620.00 16033208-5746304 Continued on next page...

Table 7. Component cross identifications with common catalogues (continued)

UNS CCDM HD GJ LHS NLTT HR PPM HIP TYC TDSC BD CoD CPD PLX 2MASS

A124 16035-5747 C 344520 8718-2861-1 -57 7500C 16033086-5746353 A125 159492 683 6549 346165 86305 8733-2365-1 -54 8403 3997.00 17380551-5430014 A126 05389-0713 A 37507 9187 1937 188306 26563 4779-700-1 -07 1142 1295.00 05385307-0712462 A127 15427+2618 A 140436 5849 104258 76952 2036-1674-1 40268 A +26 2722 3554.00 15424459+2617442 A127 15427+2618 B 76952 2036-1674-2 40268 B 3554.00 15424459+2617442 A128 15503-4524 A 141296 5872 321081 77574 8309-556-1 40570 A -45 10251 -45 7665 15501631-4524064 A128 15503-4524 B 77574 15501631-4524064 A128 15503-4524 C 77574 15501631-4524064 A129 04306+1542 A 28546 1428 119971 21039 1265-1174-1 9514 A +15 639 996.01 04303886+1541309 A129 04301+1538 A 28485 1422 119962 20995 1265-1175-1 9494 A +15 636 995.00 04300858+1538164 A129 04306+1542 B 28545 119968 1265-148-1 9514 B +15 638 996.01 04303486+1544023 A129 04301+1538 B 20995 1265-1175-2 9494 B 995.00 04300858+1538164 A130 16555 778 332013 12225 8484-1504-1 -53 457 534.00 02372435-5232354

Target selection for the SUNS/DEBRIS surveys 61

Table 8. Notes for specific systems

UNS ID Note

M009 Triple system. A,C components are very close binary, B component orbits AC (Delfosse et al. 1999) M011 CCDM lists a third component (CCDM 00184+4401 C), but this is not associated,

CCDM 00184+4401 C is TYC 2794-1389-1 M018 CCDM lists seven other components (CCDM 22281+5741 C,D,E,F,G,H,I), but these are not associated, CCDM 22281+5741 C is TYC 3991-30-1, CCDM 22281+5741 D is clearly visible in 2MASS images (22 28 10.42 +57 42 44.9), but is not in the PSC, CCDM 22281+5741 E is 2MASS 22281788+5742148, CCDM 22281+5741 F is 2MASS 22280456+5742284, identification of CCDM 22281+5741 G,H uncertain, CCDM 22281+5741 I is HD 213209 M024 CCDM lists a secondary (CCDM 17366+6822 A, HD 160861), but this is not associated M032 CCDM lists three other components (CCDM 10199+1951 A,B,D), but these are not associated, CCDM 10199+1951 A is HD 89484, CCDM 10199+1951 B is HD 89485, CCDM 10199+1951 C is BD +20 2464 M035 CCDM lists two other components (CCDM 22468+4420 B,C), but these are not associated, CCDM 22468+4420 B+C is PPM 63400 M036 Binary seperation too close to be resolved in 2MASS but is wider at other epochs M041 CCDM lists a third component (CCDM 04312+5858 C), but this is not associated,

CCDM 04312+5858 C is 2MASS 04310127+5900324 M043 CCDM lists a secondary (CCDM 05314-0341 B, BD -03 1122), but this is not associated M057 CCDM lists two other components (CCDM 23319+1956 C,D), but these are not associated, CCDM 23319+1956 C is TYC 1723-143-1, CCDM 23319+1956 D is 2MASS 23315199+1956480 M060 CCDM lists a third component (CCDM 17121+4540 C), but this is not associated,

CCDM 17121+4540 C is 2MASS 17120375+4542071 M062 GJ 644 A and GJ 644 B are spectroscopic binaries (SBC9 2683,2684) M073 Triple system. CCDM appears to have 2 entries for this system (CCDM 03019-1635, CCDM 03019-1636), although CCDM 03019-1635 is listed without proper motion, it represents all three components correctly, and CCDM 03019-1636 should probably not exist, CCDM 03019-1635 A should be HIP 14101 rather than CCDM 03019-1636 A M075 CCDM lists two other components (CCDM 20532+6210 B,C), but these are not associated, CCDM 20532+6210 B is BD +61 2067, CCDM 20532+6210 C is 2MASS 20525981+6210361 M077 Spectroscopic parallax, possibly should not be included M088 Spectroscopic parallax, possibly should not be included M089 Quadruple system, max seperation ∼ 1.5^{′′}, see Leinert et al. (2000) M098 CCDM lists a secondary (CCDM 16240+4821 B), but this is not associated,

CCDM 16240+4821 B is 2MASS 16235231+4822050 M104 CCDM lists nine other components (CCDM 19075+3231 A,B,C,D,E,F,G,J,K), but these are not associated, CCDM 19075+3231 A+B is HD 178449, CCDM 19075+3231 C is 2MASS 19072775+3230359, CCDM 19075+3231 D is BD +32 3325, CCDM 19075+3231 E is TYC 2644-1789-1, CCDM 19075+3231 F is TYC 2644-884-1, CCDM 19075+3231 G is TYC 2644-2032-1, CCDM 19075+3231 J is 2MASS 19074029+3233221, CCDM 19075+3231 K is 2MASS 19073801+3231374 M114 Single star. CNS3 identfies this as a double (GJ 1154 AB, ρ = 5^{′′}, Δmag = 1.2),

but the B component is most likely an unrelated object (2MASS 12141817+0037297)

K001 ϵ Eridani is not included in DEBRIS, as it is being observed by a Guaranteed Time project K002 PPM 86047 = FK5 793 is not a component but is the system photocentre , CCDM lists four other components (CCDM 21069+3844 C,D,E,P), but these are not associated, CCDM 21069+3844 C is BD +38 4345, CCDM 21069+3844 D is BD +38 4342, CCDM 21069+3844 E is BD +38 4349, CCDM 21069+3844 P is TYC 3168-1076-1 K003 ϵ Indi B is a brown dwarf binary K005 CCDM lists two other components (CCDM 10114+4927 B,C), but these are not associated, CCDM 10114+4927 B is HD 233714, CCDM 10114+4927 C is HD 233713 K006 CCDM lists two other components (CCDM 04153-0739 D,E), but these are not associated, CCDM 04153-0739 D is TYC 5313-183-1, CCDM 04153-0739 E is 2MASS 04153228-0730274 K007 Resolved spectroscopic binary (SBC9 1022),

CCDM lists eleven other components (CCDM 18055+0230 P,Q,R,S,T,U,V,W,X,Y,Z), but these are not associated, CCDM has incorrect epoch for CCDM 18055+0230 P (1925 vs. 1947 in WDS), CCDM 18055+0230 P is clearly visible in 2MASS images (18 05 23.96 +02 31 03.4) but is not in the PSC, CCDM 18055+0230 Q is 2MASS 18052131+0231197, CCDM 18055+0230 R is 2MASS 18053232+0232144, CCDM 18055+0230 S is 2MASS 18052976+0233083, CCDM 18055+0230 T is 2MASS 18053351+0231170, CCDM 18055+0230 U is 2MASS 18052067+0233430, CCDM 18055+0230 V is clearly visible in 2MASS images (18 05 17.81 +02 30 00.1) but is not in the PSC, CCDM 18055+0230 W is 2MASS 18050576+0230005, CCDM 18055+0230 X is 2MASS 18051670+0229550, CCDM 18055+0230 Y is clearly visible in 2MASS images (18 05 26.60 +02 33 59.1) but is not in the PSC, CCDM 18055+0230 Z is clearly visible in 2MASS images (18 05 26.52 +02 30 39.6) but is not in the PSC K008 HD 131976 is an unresolved spectroscopic binary (SBC9 1475), Continued on next page...

62 N. M. Phillips et al.

Table 8. Notes for specific systems (continued)

UNS ID Note

CCDM lists four other components (CCDM 14574-2124 C,D,E,F), but these are not associated, CCDM 14574-2124 C is 2MASS 14571953-2122161, CCDM 14574-2124 D is 2MASS 14572267-2120432, CCDM 14574-2124 E is 2MASS 14572064-2123070, CCDM 14574-2124 F is 2MASS 14571341-2119493, CCDM declination for CCDM 14574-2124 F is 30^{′′} too north K009 CCDM lists two other components (CCDM 17155-2635 D,P), but these are not associated, CCDM 17155-2635 D is HD 155849, CCDM 17155-2635 P is clearlyu visible in 2MASS images (17 15 18.07 -26 36 12.0) but is not in the PSC K010 haw96 spectral type of M3 III for GJ 783 B is most likely for another object (2MASS 20111316-3605009), GJ 783 B is just resolved from GJ 783 A in 2MASS images but is not in the PSC K011 CCDM lists two other components (CCDM 09144+5241 C,D), but these are not associated, CCDM 09144+5241 C is 2MASS 09143546+5242095, CCDM 09144+5241 D is TYC 3806-1033-1 K013 CCDM lists a secondary (CCDM 23132+5709 B, BD +56 2967), but this is not associated K015 CCDM lists a fourth component (CCDM 17190-3459 D), but this is not associated, CCDM 17190-3459 D is 2MASS 17185199-3459041, TYC2 and TDSC don’t have CCDM component set for TYC 7370-850-1 and TYC 7370-850-2 K016 CCDM lists a secondary (CCDM 00483+0516 B), but this is not associated,

CCDM 00483+0516 B is 2MASS 00481380+0515316 K017 CCDM lists two other components (CCDM 01425+2016 B,C), but these are not associated, CCDM 01425+2016 B is 2MASS 01423045+2016596, CCDM 01425+2016 C is 2MASS 01423050+2018410 K018 Resolved spectroscopic binary (SBC9 57), GJ 53 B is not CCDM 01080+5455 B,

CCDM lists four other components (CCDM 01080+5455 B,C,D,P), but these are not associated, CCDM 01080+5455 B is TYC 3673-194-1, CCDM 01080+5455 C is TYC 3673-40-1, CCDM 01080+5455 D is 2MASS 01075362+5454488, CCDM 01080+5455 P is 2MASS 01074545+5456284 K023 CCDM lists a third component (CCDM 05025-2115 C), but this is not associated,

CCDM 05025-2115 C is probably 2MASS 05022934-2114598 although the position is out by 7^{′′}, 2MASS 05022907-2115086 is closer to CCDM position but it is most likely an artifact as it is not visible in 2MASS images K026 CCDM lists two other components (CCDM 17191-4638 C,D), but these are not associated, CCDM 17191-4638 C is 2MASS 17184972-4638190, CCDM 17191-4638 D is 2MASS 17185584-4637476, CCDM is missing epoch for CCDM 17191-4638 D, WDS says 1900 which gives position compatible with 2MASS K030 CCDM lists a secondary (CCDM 16363-0220 B), but this is not associated,

CCDM 16363-0220 B is 2MASS 16361266-0219426 K037 CCDM lists a third component (CCDM 17051-0504 C), but this is not associated,

CCDM 17051-0504 C is TYC 5072-461-1 K040 HD 223778 is an unresolved spectroscopic binary (SBC9 1459)

CCDM lists a third component (CCDM 23526+7532 C), but this is not associated, CCDM 23526+7532 C is TYC 4602-652-1 K042 Unresolved spectroscopic binary (SBC9 1802) K045 CCDM lists a secondary (CCDM 00394+2115 B), but this is not associated,

CCDM 00394+2115 B is TYC 1193-917-1 K046 CCDM lists a third component (CCDM 13169+1701 C), but this is not associated, CCDM 13169+1701 C is 2MASS 13164800+1702543 K049 CCDM lists a third component (CCDM 08555+7048 C), but this is not associated, CCDM 08555+7048 C is TYC 4378-2170-1 K050 CCDM lists three other components (CCDM 00057+4548 C,D,E), but these are not associated, CCDM 00057+4548 C is 2MASS 00053131+4548261, CCDM 00057+4548 D is TYC 3246-1146-1, CCDM 00057+4548 E is TYC 3246-1100-1, CCDM 00057+4548 D,E are not in TDSC K053 Unresolved spectroscopic binary (SBC9 820) K056 CCDM lists three other components (CCDM 11110+3028 C,D,R), but these are not associated, CCDM 11110+3028 C is BD +31 2239, CCDM 11110+3028 D is 2MASS 11111500+3030044, CCDM 11110+3028 R is probably 2MASS 11110182+3031238 although CCDM position is 18^{′′} too North K058 CCDM lists three other components (CCDM 05413+5329 D,P,Q), but these are not associated, CCDM 05413+5329 D is BD +53 930, CCDM 05413+5329 P is 2MASS 05411251+5330239, CCDM 05413+5329 Q is 2MASS 05413566+5328047 K066 CCDM lists a secondary (CCDM 05284-0331 B), but this is not associated,

CCDM 05284-0331 B is 2MASS 05282454-0330492 K070 CCDM lists two other components (CCDM 13454+1746 B,C), but these are not associated, CCDM 13454+1746 B is TYC 1463-851-1, CCDM 13454+1746 C is BD +18 2777 K102 CCDM lists two other components (CCDM 11153+7328 B,D), but these are not associated, CCDM 11153+7328 B+D is PPM 54976 K110 Resolve spectroscopic binary (SBC9 402) K116 CCDM lists two other components (CCDM 21054+0704 B,C), but these are not associated, CCDM 21054+0704 B is TYC 538-740-1, CCDM 21054+0704 C is HD 200806 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 63

Table 8. Notes for specific systems (continued)

UNS ID Note

K117 Both components listed here are themselves binaries.

K120 CCDM lists a third component (CCDM 05192-0305 C), but this is not associated,

CCDM 05192-0305 C is TYC 4756-398-1

G001 Proxima distance: 1.301 ± 0.001 pc (YPC,HIPnr,ben99) G002 τ Ceti is not included in DEBRIS, as it is being observed by a Guaranteed Time project CCDM lists a secondary (CCDM 01441-1557 B), but this is not associated, CCDM 01441-1557 B is 2MASS 01440770-1558204 G003 CCDM lists a secondary (CCDM 19322+6941 B), but this is not associated,

CCDM 19322+6941 B is TYC 4448-2117-1 G004 CCDM lists six other components (CCDM 00491+5749 C,D,E,F,G,H), but these are not associated, CCDM 00491+5749 C is 2MASS 00483853+5748135, CCDM 00491+5749 D is 2MASS 00490544+5751559, CCDM 00491+5749 E is BD +57 155, CCDM 00491+5749 F is TYC 3663-1484-1, CCDM 00491+5749 G is BD +56 129, CCDM 00491+5749 H is HD 236533 G006 CCDM lists two other components (CCDM 14513+1906 C,D), but these are not associated, CCDM 14513+1906 C is 2MASS 14512179+1907087, CCDM 14513+1906 D is 2MASS 14511264+1906463, TYC proper motion is likely inaccurate G007 CCDM lists a secondary (CCDM 12337+4121 C), but this is not associated,

CCDM has ρ = 76.2^{′′} which should be ρ = 276.2^{′′}, CCDM 12337+4121 C is 2MASS 12333604+4117198 G008 CCDM lists a secondary (CCDM 13185-1818 B, BD -17 3815), but this is not associated G009 Unresolved spectroscopic binary (SBC9 1535) G010 CCDM lists a secondary (CCDM 13118+2753 B), but this is not associated,

CCDM 13118+2753 B is 2MASS 13115140+2750473 G011 CCDM lists two other components (CCDM 03194+0321 B,C), but these are not associated, CCDM 03194+0321 B is BD +02 521, CCDM 03194+0321 C is 2MASS 03191255+0318057 G013 CCDM lists a secondary (CCDM 11411+3412 B), but this is not associated,

CCDM 11411+3412 B is TYC 2525-1226-1 G014 CCDM lists a secondary (CCDM 01477+6351 B, BD +63 241), but this is not associated G016 Unresolved spectroscopic binary (SBC9 117), CCDM lists a secondary (CCDM 02170+3414 B), but this is not associated, CCDM 02170+3414 B is 2MASS 02165264+3414501 G020 Resolved spectroscopic binary (SBC9 1468), CCDM lists two other components

(CCDM 00021+2706 C,D), but these are not associated, CCDM 00021+2706 C is BD +26 4735, CCDM 00021+2706 D is 2MASS 00015779+2707010 G023 CCDM lists seven other components (CCDM 05192+4007 B,C,D,E,F,G,H), but these are not associated, CCDM 05192+4007 B is 2MASS 05190143+4007054, CCDM 05192+4007 C is 2MASS 05190185+4006382, CCDM 05192+4007 D is BD +39 1250, CCDM 05192+4007 E is PPM 47982, CCDM 05192+4007 F is 2MASS 05190079+4005292, CCDM 05192+4007 G is PPM 47981, CCDM 05192+4007 H is TYC 2900-1269-1 G025 Resolved spectroscopic binary (SBC9 826) G026 Resolved spectroscopic binary (SBC9 2546) G030 CCDM lists three other components (CCDM 00065+2900 B,C,D), but these are not associated, CCDM 00065+2900 B is TYC 1735-937-1, CCDM 00065+2900 C is 2MASS 00063345+2859011, CCDM 00065+2900 D is 2MASS 00063339+2859000 G032 CCDM lists a secondary (CCDM 16156-0822 B), but this is not associated,

CCDM 16156-0822 B is 16153490-0821457 G034 GJ 684 A,B are resolved spectroscopic binary (SBC9 2557) G035 CCDM lists two other components (CCDM 17206+3229 B,C), but these are not associated, CCDM 17206+3229 B is TYC 2596-50-1, CCDM 17206+3229 C is 2MASS 17203036+3232468 G038 GJ 596.1 B is partially resolved from HD 140538 in 2MASS images,

CCDM lists three other components (CCDM 15439+0230 C,D,E), but these are not associated, CCDM 15439+0230 C is HD 140527, CCDM 15439+0230 D is TYC 355-250-1, CCDM 15439+0230 E is HD 140489 G040 Companion is unlikely to be CCDM 10010+3155 B due to large seperation and incompatible magnitude, companion position taken from 2MASS PSC with proper motion from primary, LSPM proper motion too small G043 GJ 599 B is not in 2MASS PSC, but is clearly visible in 2MASS images (15 47 30.04 -37 55 08.3), CCDM lists a third component (CCDM 15475-3755 C), but this is not associated, CCDM 15475-3755 C is 2MASS 15473122-3754547 G044 Resolved spectroscopic binary (SBC9 1470) G053 CCDM lists a secondary (CCDM 21483-4718 B, CoD -47 13929), but this is not associated G054 Resolved spectroscopic binary (SBC9 969) G055 Resolved spectroscopic binary (SBC9 478) G058 CCDM lists two other components (CCDM 04053+2201 B,C), but these are not associated, CCDM 04053+2201 B is BD +21 588, CCDM 04053+2201 C is 2MASS 04052329+2202551 Continued on next page...

64 N. M. Phillips et al.

Table 8. Notes for specific systems (continued)

UNS ID Note

G061 Spectroscopic binary (SBC9 799) G064 CCDM lists a secondary (CCDM 16011+3318 B), but this is not associated,

CCDM 16011+3318 B is TYC 2576-1159-1 G067 Unresolved spectroscopic binary (SBC9 868), CCDM lists a secondary (CCDM 15533+1312 B), but this is not associated, CCDM 15533+1312 B is 2MASS 15531910+1311567 G072 CCDM lists a third component (CCDM 21072-1355 C), but this is not associated,

CCDM 21072-1355 C is 2MASS 21070865-1355148 G073 CCDM lists a secondary (CCDM 13168+0925 B), but this is not associated,

CCDM 13168+0925 B is 2MASS 13164978+0925206 G078 CCDM lists five other components (CCDM 20040+1705 B,C,P,Q,R), but these are not associated, CCDM 20040+1705 B is TYC 1621-943-1, CCDM 20040+1705 C is HD 190338, CCDM 20040+1705 P is 2MASS 20040614+1705353, CCDM 20040+1705 Q is BD +16 4117, CCDM 20040+1705 R is 2MASS 20035883+1705478 G079 CCDM lists a secondary (CCDM 11268+0300 C), but this is not visible in POSS or 2MASS images G081 Resolved spectroscopic binary (SBC9 842), CCDM lists two other components (CCDM 15233+3018 C,D), but these are not associated, CCDM 15233+3018 C is flagged as a persistence artifact in 2MASS (15 23 12.28 +30 18 28.3), CCDM 15233+3018 D is 2MASS 15232339+3019597 G083 HD 202940 is an unresolved spectroscopic binary (SBC9 1292), CCDM lists three other components (CCDM 21198-2621 C,D,E), but these are not associated, CCDM 21198-2621 C is 2MASS 21195531-2620137, CCDM 21198-2621 D is 2MASS 21200501-2618437, CCDM 21198-2621 E is 2MASS 21195679-2618176 G089 Unresolved spectroscopic binary (SBC9 1531) G090 CCDM lists a secondary (CCDM 20052+3829 B), but this is not associated,

CCDM 20052+3829 B is 2MASS 20050695+3828229 G096 CCDM lists three other components (CCDM 06172+0505 B,P,Q), but these are not associated, CCDM 06172+0505 B is HD 254595, CCDM 06172+0505 P is 2MASS 06171345+0505419, CCDM 06172+0505 Q is 2MASS 06171372+0505030 G100 Unresolved spectroscopic binary (SBC9 558), CCDM lists a secondary (CCDM 09143+6125 B), but this is not seen in 2MASS images and is not in the WDS G102 HD 217107. Binary resolved by speckle imaging (McAlister et al. 1987 ρ = 0.457^{′′} , θ = 164.0^∘ or 344.0^∘) G104 HD 137763 is an unresolved spectroscopic binary (SBC9 1638), CCDM lists a third component (CCDM 15282-0921 C, BD -08 3984), but this is not associated G107 CCDM lists two other components (CCDM 22266-1644 C,D), but these are not associated, CCDM 22266-1644 C is 2MASS 22263123-1643443, CCDM 22266-1644 D is marginally resolved from CCDM 22266-1644 C in 2MASS images G108 CCDM lists a secondary (CCDM 10189+4403 B, BD +44 1975), but this is not associated G109 Resolved spectroscopic binary (SBC9 559), CPM secondary 2MASS 09121469+1459396 is brown dwarf, CCDM lists two other components (CCDM 09123+1459 B,C), but these are not associated, CCDM 09123+1459 B is 2MASS 09122305+1459047, CCDM 09123+1459 C is BD +15 2001 G111 Binary measured by micrometer (Heintz 1980,1990 ρ̄ = 2.605^{′′}, θ̄ = 254.8^∘), no other references, marginally resolved in 2MASS images G113 CCDM lists a secondary (CCDM 22249-5748 B), but this is not associated,

CCDM 22249-5748 B is 2MASS 22244626-5748056 G117 GJ 797 B (NLTT 49681) is CCDM 20408+1956 C, not CCDM 20408+1956 B. CCDM probably has incorrect θ for CCDM 20408+1956 C, it is mirrored about due south, CCDM lists a third component (CCDM 20408+1956 B), but this is not associated, CCDM 20408+1956 B is 2MASS 20404719+1957100 G118 CCDM lists a secondary (CCDM 00228-1212 B), but this is not associated,

CCDM 00228-1212 B is 2MASS 00223841-1211072 G122 HD 146361 is an unresolved spectroscopic binary (SBC9 894), CCDM lists two other components (CCDM 16147+3352 C,D), but these are not associated, CCDM 16147+3352 C is visible in 2MASS images (16 14 42.61 +33 51 28.7) but is not in the PSC, CCDM 16147+3352 D is TYC 2583-1900-1 G124 CCDM lists three other components (CCDM 04155+0612 C,D,E), but these are not associated, CCDM 04155+0612 C is PPM 147359 (this is very bright in 2MASS), CCDM 04155+0612 D is PPM 147360 (this is TDSC 8986 E), CCDM 04155+0612 E is PPM 147356

F001 Procyon has DA white dwarf secondary (GJ 280 B), CCDM 07393+0514 C,D,E are not associated, CCDM 07393+0514 C is 2MASS 07392181+0516077, CCDM 07393+0514 D is not in 2MASS PSC, but has three entries in 2MASS Survey Point Source Reject Table , CCDM 07393+0514 E is TYC 187-804-1 F002 Spectroscopic binary (SBC9 1058).

CCDM lists two wide secondaries (CCDM 18211+7245 B,C), but these are not associated, CCDM 18211+7245 B is TYC 4437-465-1, CCDM 18211+7245 C is 2MASS 18210058+7246592 F003 CCDM lists a secondary (CCDM 04499+0657 B), but this is not associated

CCDM 04499+0657 B is TYC 96-137-1 F006 CCDM lists a third component (CCDM 05445-2226 C) but this is not associated Continued on next page...

Target selection for the SUNS/DEBRIS surveys 65

Table 8. Notes for specific systems (continued)

UNS ID Note

CCDM 05445-2226 C is CPD -22 883, 2MASS 05442769-2223272, ρ, θ in CCDM are suspect F008 CCDM lists a secondary (CCDM 03091+4936 B), but this is not associated

CCDM 03091+4936 B is visible in 2MASS images, but is flagged as a persistence artifact F009 CCDM lists two wide secondaries (CCDM 11507+0146 B,C), but these are not associated CCDM 11507+0146 B is 2MASS 11502130+0147182, CCDM 11507+0146 C is HD 102959 F010 CCDM lists a third component (CCDM 02441+4913 C) but this is not associated

CCDM 02441+4913 C is 2MASS 02440341+4912590 F011 CCDM lists two wide secondaries (CCDM 15564+1540 B,C), but these are not associated CCDM 15564+1540 B is TYC 1496-1100-1, CCDM 15564+1540 C is 2MASS 15561847+1541093 F013 CCDM lists a secondary (CCDM 22070+2520 B), but this is not associated

CCDM 22070+2520 B is TYC 2208-1501-1 F014 CCDM lists two wide secondaries (CCDM 12417-0127 C,D), but these are not associated CCDM 12417-0127 C is 2MASS 12414474-0127468, CCDM 12417-0127 D is visble in 2MASS images, but is not in the 2MASS PSC F015 CCDM lists two wide secondaries (CCDM 21470-1607 B,C), but these are not associated CCDM 21470-1607 B is not in 2MASS PSC, but has 3 entries in 2MASS Survey Point Source Reject Table, CCDM 21470-1607 C is 2MASS 21465364-1606114 F017 CCDM lists a secondary (CCDM 15551-6326 B), but this has only been observed once and is not seen in 2MASS images. 2MASS images show two very bright objects near this star (2MASS 15544842-6323328, 2MASS 15544492-6326284), but these are much less bright in visible images - obscured background objects?.

F019 Secondary component (GJ 354 B) has V ∼ 14, ρ ∼ 4^{′′}. Primary is not a spectroscopic binary F020 CCDM lists two wide secondaries (CCDM 01367+4125 B,C), but these are not associated, CCDM 01367+4125 B is 01365706+4123423, CCDM 01367+4125 C is TYC 2822-2067-1 F021 CCDM lists a secondary (CCDM 23399+0538 B), but this is not associated,

CCDM CCDM 23399+0538 B is 2MASS 23395050+0538414 F025 CCDM lists another component (CCDM 05244+1723 B, HD 243294), but this is not associated F029 CCDM lists four other components (CCDM 18570+3254 C,D,E,F), but these are not associated, CCDM 18570+3254 C is 2MASS 18565628+3254324, CCDM 18570+3254 D is 2MASS 18565948+3252442, CCDM 18570+3254 E is 2MASS 18565517+3255345, CCDM 18570+3254 F is 2MASS 18570853+3254207 F035 CCDM lists a secondary (CCDM 19254+0307 B), but this is not associated,

CCDM 19254+0307 B is 2MASS 19252106+0306452 F037 CCDM lists a third component (CCDM 18071+3034 C), but this is not associated,

CCDM 18071+3034 C is 2MASS 18070796+3034331 F039 CCDM lists two wide secondaries (CCDM 14347+2945 B,C), but these are not associated CCDM 14347+2945 B is TYC 2021-709-1, CCDM 14347+2945 C is TYC 2021-991-1 F040 CCDM lists three other components (CCDM 09007+4147 C,D,E), but these are not associated, CCDM 09007+4147 C is TYC 2986-284-1, CCDM 09007+4147 D is BD +42 1955, CCDM 09007+4147 E is probably TYC 2986-1082-1 although it is off by 40^{′′} in declination F041 Secondary (GJ 294 B, CCDM 07578-6018 B,C) is marginally resolved in 2MASS images F043 CCDM lists a third component (CCDM 22467+1211 C), but this is not associated,

CCDM 22467+1211 C is 2MASS 22464282+1213188 F044 CCDM lists a secondary (CCDM 06467+4335 B, BD +43 1596), but this is not associated F048 Primary (HD 81997) is a spectroscopic binary (SBC9 2549), GJ 348 B is seperated 65.7^{′′} from the primary F049 Marginally resolved in 2MASS images F055 CCDM lists a third component (CCDM 13100+1732 C), but this is not associated,

CCDM 13100+1732 C is 2MASS 13095776+1733113 F057 Marginally resolved in 2MASS images F058 CCDM lists two other components (CCDM 07290+3147 C,D), but these are not associated, CCDM 07290+3147 C is TYC 2452-1-1, CCDM 07290+3147 D is 2MASS 07284191+3148033 F059 CCDM lists a third component (CCDM 14190-2549 C), but this is not associated,

CCDM 14190-2549 C is 14190635-2549335 F060 Marginally resolved in 2MASS images F065 Not resolved in 2MASS images, CCDM lists a third component (CCDM 19364+5013 C), but this is not associated, CCDM 19364+5013 C is not in the 2MASS PSC, but it is in the Point Source Reject Table F066 Spectroscopic binary (SBC9 1290), CCDM lists a third component (CCDM 21145+1001 C, AGK +09 2950), but this is not associated F067 Spectroscopic binary (SBC9 442), marginally resolved in 2MASS images F068 CCDM lists four other components (CCDM 00531+6107 B,C,D,E), but these are not associated, CCDM has wrong sign of pmRA for primary. CCDM 00531+6107 B+C is 2MASS 00530767+6105053, CCDM 00531+6107 D is 2MASS 00531259+6105583, CCDM 00531+6107 E is 2MASS 00531622+6108539, WDS has wrong ’sep1’ value of 193.2^{′′} for D component - it should be 93.2^{′′} at that epoch (1922) F072 Secondary (GJ 768.1 B) is CCDM 19510+1025 C, not CCDM 19510+1025 B,

CCDM 19510+1025 B is 2MASS 19510058+1024488, CCDM 19510+1025 C is 19510068+1024400 Continued on next page...

66 N. M. Phillips et al.

Table 8. Notes for specific systems (continued)

UNS ID Note

F073 CCDM lists four other components (CCDM 18457+2033 B,C,P,Q), but these are not associated, CCDM 18457+2033 B is 2MASS 18454306+2033228, CCDM 18457+2033 C is 2MASS 18454414+2033250, CCDM 18457+2033 P is just visible in 2MASS images but is not in th PSC, CCDM 18457+2033 Q is 2MASS 18454068+2033437 F074 CCDM lists two other components (CCDM 06165+1216 B,C), but these are not associated, CCDM 06165+1216 B is 2MASS 06162684+1215487, CCDM 06165+1216 C is HD 254377 F076 CCDM lists two other components (CCDM 15074+2453 B,C), but these are not associated, CCDM 15074+2453 B is 2MASS 15072317+2453263, CCDM 15074+2453 C is GJ 579 F078 CCDM lists a secondary (CCDM 12068-6437 B), but this is not associated,

CCDM 12068-6437 B is 2MASS 12064641-6436255 F079 Existence of GJ 818.1 B is considered questioable in CNS3 and WDS F081 GJ 174.1 B is clearly visble in 2MASS images and has 11 entries in the Point Source Reject Table, but it is not in the PSC F082 CCDM lists two other components (CCDM 07299+4941 B,C), but these are not associated, CCDM 07299+4941 B is TYC 3401-1447-1, CCDM 07299+4941 C is 2MASS 07294539+4940395 F083 Third component (GJ 822.1 C) is CCDM 21148+3803 Q not CCDM 21148+3803 C, CCDM lists three other components (CCDM 21148+3803 C,D,P), but these are not associated, CCDM 21148+3803 C is 2MASS 21144444+3801471, CCDM 21148+3803 D is BD +37 4237, CCDM 21148+3803 P is 2MASS 21144049+3802277 F084 Marginally resolved in 2MASS images, CCDM lists a third component (CCDM 09105+6707 C, HIP 45064), but this is not associated F086 CCDM lists a secondary (CCDM 23167+5313 B), but this is not associated,

CCMD 23167+5313 B is 2MASS 23163210+5314431 F089 CCDM lists three other components (CCDM 06148+1909 B,C,D), but these are not associated, CCDM 06148+1909 B is 2MASS 06145073+1909131, CCDM 06148+1909 C is 2MASS 06144566+1909143, CCDM 06148+1909 D is 2MASS 06144614+1909349 F090 CCDM lists two other components (CCDM 05227+7913 B,C), but these are not associated, CCDM 05227+7913 B is BD +79 168, CCDM 05227+7913 C is BD +79 167, CCDM θ (and WDS pa1) for CCDM 05227+7913 C is incorrect by 180^∘. WDS also has mag1,mag2 fields reversed F091 CCDM lists another two components (CCDM 04075+3803 C+D, HD 25866), but these are not associated, F092 CCDM lists a third component (CCDM 00352-0336 C), but this is not associated,

CCDM 00352-0336 C is 2MASS 00351387-0335147 F094 This system is in a very crowded area. CCDM lists four other components (CCDM 19465+3343 C, CCDM 19456+3336 C,D,E), but these are not associated, CCDM 19465+3343 C is HD 225744, comparison of POSS-I and 2MASS images shows no common proper motion companions within 2^′ of GJ 765.4 A+B F104 CCDM lists a secondary (CCDM 10314-5343 B, SAO 238148), but this is not associated F106 CCDM lists three other components (CCDM 21442+2845 C,D,E), but these are not associated, CCDM 21442+2845 C is 2MASS 21440333+2844580, CCDM 21442+2845 D is HD 206874, CCDM 21442+2845 E is 2MASS 21441793+2846578 F107 Spectroscopic binary (SBC9 1477) with well determined orbit F108 CCDM lists a secondary (CCDM 12152-1019 B), but this is not associated,

CCDM 12152-1019 B is 2MASS 12151329-1018300 F110 Marginally resolved in 2MASS images F112 Marginally resolved in 2MASS images F114 CCDM lists a secondary (CCDM 18138+6424 B), but this is not associated,

CCDM 18138+6424 B is TYC 4209-1432-1 F115 CCDM lists two other components (CCDM 17420+7209 C,D), but these are not associated, CCDM 17420+7209 C is 2MASS 17421275+7208319, CCDM 17420+7209 D is 2MASS 17421750+7209374 F116 Secondary component (CCDM 18197-6353 B) is 2MASS 18193998-6353040 F118 CCDM lists a secondary (CCDM 17369+6845 B), but this is not associated,

CCDM 17369+6845 B is 2MASS 17364375+6845078 F120 CCDM lists three other components (CCDM 11387+4506 C,D,E), but these are not associated, CCDM 11387+4506 C is BD +45 1948, CCDM 11387+4506 D is 2MASS 11384197+4507269, CCDM 11387+4506 E is HD 101319 F124 CCDM lists two other components (CCDM 00490+1656 B,C), but these are not associated, CCDM 00490+1656 B is 2MASS 00485577+1657382, CCDM 00490+1656 C is 2MASS 00490009+1655257 F128 CCDM lists a third component (CCDM 09315+6303 C), but this is not associated,

CCDM 09315+6303 C is 2MASS 09311960+6302368 F130 Spectroscopic binary (SBC9 135)

A001 CCDM and WDS list a third component (CCDM 06451-1643 C) orbiting Sirius B, but this is not well confirmed, and is not included here. CCDM lists a wide secondary (CCDM 06451-1643 D), but this is not associated, CCDM 06451-1643 D is visible in 2MASS images (06 45 11.72 -16 41 48.7) but is not in the PSC Continued on next page...

Target selection for the SUNS/DEBRIS surveys 67

Table 8. Notes for specific systems (continued)

UNS ID Note

A002 Altair is included in DEBRIS despite just missing confusion cut (1.24 vs. 1.20 mJy/beam),

CCDM lists two other components (CCDM 19508+0852 B,C), but these are not associated, CCDM 19508+0852 B is 2MASS 19503473+0853019, CCDM 19508+0852 C is 2MASS 19505953+0851129 (ρ in CCDM is slightly too large) A003 Vega is not included in DEBRIS, as it is being observed by a Guaranteed Time project,

CCDM lists four other components (CCDM 18369+3847 B,C,D,E), but these are not associated, CCDM 18369+3847 B is PPM 81557 and is visible in 2MASS images, but is flagged as a persistence artifact, CCDM 18369+3847 C is clearly visible in 2MASS images (18 36 50.24 +38 46 44.6), but is not in the PSC, CCDM 18369+3847 D is clearly visible in 2MASS images (18 36 51.52 +38 47 10.7), but is not in the PSC, CCDM 18369+3847 E is 2MASS 18370125+3848126 A004 Fomalhaut is not included in DEBRIS, as it is being observed by a Guaranteed Time project A005 CCDM lists three other components (CCDM 11490+1433 B,C,D), but these are not associated, CCDM 11490+1433 B has only been reported once in 1898, and is not seen in 2MASS images CCDM 11490+1433 C is 2MASS 11490608+1435497 CCDM 11490+1433 D is BD +15 2382 A006 HD 60179 and HD 60178 are both spectroscopic binaries (SBC9 462, SBC9 461),

CCDM lists another component (CCDM 07346+3153 D, BD +32 1580), but this is not associated A007 Quadruple system, A component is a spectroscopic binary (SBC9 543), B+C pair orbits this A009 CCDM lists three other components (CCDM 21186+6236 B,C,D), but these are not associated, CCDM 21186+6236 B is TYC 4252-1354-1, CCDM 21186+6236 C is 2MASS 21184438+6237559, CCDM 21186+6236 D is 2MASS 21184478+6237553 A011 CCDM lists two other components (CCDM 11141+2032 B,C), but these are not associated,

CCDM 11141+2032 B is TYC 1439-1307-1, CCDM 11141+2032 C is 2MASS 11141002+2032493 A012 Spectroscopic binary (SBC9 98) A018 Eclipsing binary, spectroscopic binary (SBC9 850) A019 Possible spectroscopic binary, but secondary is not CCDM 17151+2451 B, WDS uses Aa,Ab for primary and secondary, CCDM lists three other components (CCDM 17151+2451 B,C,D), but these are not associated, CCDM 17151+2451 B is clearly visible in 2MASS images (17 15 01.10 +24 50 23.0), but is not in the PSC, CCDM 17151+2451 C is TYC 2065-1436-1, CCDM 17151+2451 D is TYC 2065-1223-1 A020 HD 130819 is a spectroscopic binary (SBC9 2554), CCDM lists a third component (CCDM 14508-1602 C), but this is not associated, CCDM 14508-1602 C is 2MASS 14503484-1600518 A025 HD 74956 is an eclipsing binary (Aa+Ab components), GJ 321.3 B orbits this, CCDM and CNS3 list two other components (GJ 321.3 C,D), but these are not associated. GJ 321.3 C does appear to have proper motion in the direction of HD 74956 but of a lesser magnitude, spectral type of G8 V for GJ 321.3 C is also too early for its V magnitude at the distance of this system, GJ 321.3 D appears to have negligeable proper motion A026 CCDM lists two other components (CCDM 12155+5702 B,C), but these are not associated,

CCDM 12155+5702 B is TYC 3837-884-1, CCDM 12155+5702 C is TYC 3837-771-1 A027 Spectroscopic binary (SBC9 366),

CCDM lists two other components (CCDM 05596+4457 B,P), but these are not associated, CCDM 05596+4457 B is TYC 2924-178-1, CCDM 05596+4457 P is visible in 2MASS images (05 59 32.20 +44 56 38.5) but is not in the PSC A028 Mizar A is a spectroscopic binary (HD 116656 + CCDM 13240+5456 B). Mizar B is HD 116657, Alcor is HD 116842 A029 Secondary component (CCDM 11249-1741 B) marginally resolved in 2MASS images A030 Secondary component (CCDM 19055+1352 B) marginally resolved in 2MASS images, CCDM lists a third component CCDM 19055+1352 C, CCDM 19055+1352 C is 2MASS 19053531+1352283, comparison of POSS-I, POSS-II and 2MASS images shows CCDM 19055+1352 C to have μ_α∗ = 37 mas/yr, μ_δ = −66 mas/yr, which is not sufficiently similar to be considered associated with this system A033 Spectroscopic binary (SBC9 143),

CCDM lists a third component (CCDM 02449+1007 C), but this is not associated, CCDM 02449+1007 C is 2MASS 02445353+1009230 (CCDM position is incorrect, but ρ, θ are correct) A034 HD 165777 may be a close binary (CCDM 18073+0934 A,B), but this is not well confirmed, secondary GJ 9615 B is CCDM 18073+0934 C, CCDM lists another component (CCDM 18073+0934 D), but this is not associated, CCDM 18073+0934 D is 2MASS 18072223+0932504 A036 CCDM lists a third component (CCDM 19026-2953 C), but this is probably not associated,

CCDM 19026-2953 C is TYC 6885-2777-1, association is hard to prove due to low proper motions A037 CCDM lists two other components (CCDM 17104-1544 C,D), but these are not associated,

CCDM 17104-1544 C is 2MASS 17102636-1544538, CCDM 17104-1544 D is 2MASS 17101582-1543087, CNS3 has misleading entry of GJ 656.1 BC which seems to include CCDM 17104-1544 C which is 100^{′′} away A040 CCDM lists a secondary (CCDM 05079-0506 B), but this is not associated,

CCDM 05079-0506 B is 2MASS 05075632-0506368 A046 CCDM lists three other components (CCDM 18470+1811 B,C,D), but these are not associated, CCDM 18470+1811 B is 2MASS 18465448+1810007, CCDM 18470+1811 C is BD +18 3820, Continued on next page...

68 N. M. Phillips et al.

Table 8. Notes for specific systems (continued)

UNS ID Note

CCDM 18470+1811 D is TYC 1587-425-1 A047 Secondary (HD 284336) is probably CCDM 04173+2035 B and θ or ρ is incorrect in CCDM A048 possibly physically related to UNS A053 (HD 125162) with physical seperation ∼ 3 pc,

CCDM lists a third component (CCDM 14162+5122 C), but this is not associated, CCDM 14162+5122 C is 2MASS 14160870+5120298 A050 HD 209790 is a spectroscopic binary (SBC9 1350),

CCDM lists another component (CCDM 22038+6437 C), but this is not associated, CCDM 22038+6437 C is 2MASS 22033972+6436023 A052 HD 159560 is a spectroscopic binary (SBC9 976) A053 possibly physically related to UNS A048 (HD 125161) with physical seperation ∼ 3 pc A054 CCDM lists a secondary (CCDM 01259+6014 B), but this is not associated,

CCDM 01259+6014 B is TYC 4031-1418-1 A058 CCDM lists a secondary (CCDM 22313+5017 B), but this is not associated,

CCDM 22313+5017 B is 2MASS 22311302+5017102 A060 Spectroscopic binary (SBC9 410),

CCDM lists two other components (CCDM 06377+1624 B,C), but these are not associated, CCDM 06377+1624 B is 2MASS 06373399+1624599, CCDM 06377+1624 C is 2MASS 06373837+1626117 A062 CCDM lists a secondary (CCDM 09368-4921 B), but this is not associated,

CCDM 09368-4921 B is 2MASS 09364863-4920595 A064 Spectroscopic binary (SBC9 165) A065 Spectroscopic binary (SBC9 846) A066 CCDM lists four other components (CCDM 12021+4304 B,C,D,E), but these are not associated, CCDM 12021+4304 B is HD 104556, CCDM 12021+4304 C is HD 104526, CCDM 12021+4304 D+E is HD 104425 A068 HD 91312 has previously been reported as a spectroscopic binary, but is not included in the SB9 CCDM lists a secondary (CCDM 10332+4026 B), but this is not associated, CCDM 10332+4026 B is not in the 2MASS PSC but is clearly visble in 2MASS images (10 33 13.72 +40 25 49.0) A070 HD 12111 + TYC 4315-2126-2 are a spectroscopic binary (SBC9 103),

CCDM lists a fourth component (CCDM 02020+7054 D), but this is not associated, CCDM 02020+7054 D is clearly visible in 2MASS images (02 02 08.26 +70 54 28.2), but is not in the PSC A072 CCDM lists two other components (CCDM 04548+1009 B,P), but these are not associated, CCDM 04548+1009 B is HD 31270, CCDM 04548+1009 P is clearly visible in 2MASS images (04 54 53.61 +10 09 47.2), but is not in the PSC A073 CCDM 02398-4254 B is associated, astrometry in CCDM and 2MASS consistent with proper motion of primary A075 possible companion 2MASS 04030931+0559056 (ρ = 16^{′′}), but hard to determine whether it is associated due to very small proper motion of both stars, 2MASS colours are inconsistent with an M-type companion A080 CCDM lists a secondary (CCDM 19014+4656 B), but this is not associated,

CCDM 19014+4656 B is 2MASS 19012205+4656190 A081 A080 and A081 in wrong distance order due to parallax of HD 44770 not originally being incorporated, CCDM lists a third component (CCDM 06237+0436 C), but the proper motion of the system is too low to confirm association A083 CCDM lists two other components (CCDM 09188+3648 C,D), but these are not associated, CCDM 09188+3648 C is 2MASS 09184662+3647039, CCDM 09188+3648 D is 2MASS 09183624+3647408 A086 Spectroscopic binary (SBC9 111) A088 CCDM lists a secondary (CCDM 11456-6644 B), but this is not associated,

CCDM 11456-6644 B is clearly visible in 2MASS images, but is not in the PSC A090 CCDM lists three other components (CCDM 00568+3830 B,C,D), but these are not associated, CCDM 00568+3830 B is 2MASS 00564143+3830203, CCDM 00568+3830 C is 2MASS 00564656+3829332, CCDM 00568+3830 D is TYC 2798-502-1 A093 CCDM lists a fourth component (CCDM 12415-4858 C), but this is not associated,

CCDM 12415-4858 C is 2MASS 12405680-4904019 A096 CCDM lists a secondary (CCDM 17054+1245 B), but this is not associated,

CCDM 17054+1245 B is 2MASS 17051942+1245032 A097 HD 148367 + CCDM 16278-0822 B are a spectroscopic binary (SBC9 904) A099 CCDM lists a secondary (CCDM 01112+5508 B), but this is not associated,

CCDM 01112+5508 B is TYC 3673-1716-1 A100 CCDM lists a secondary (CCDM 20501+4404 B), but this is not associated,

CCDM 20501+4404 B is 2MASS 20500889+4404130 A109 Secondary component (CCDM 23489-2808 B) marginally resolved in 2MASS images A112 CCDM lists a fourth component (CCDM 02292+6725 D, HD 15149), but this is probably not associated A116 CCDM lists four other components (CCDM 20146+3647 B,C,D,P), but these are not associated, CCDM 20146+3647 B is HD 192661, CCDM 20146+3647 C is TYC 2683-2963-1, CCDM 20146+3647 D is 2MASS 20145534+3643201, CCDM 20146+3647 P is 2MASS 20143042+3648525 Continued on next page...

Target selection for the SUNS/DEBRIS surveys 69

Table 8. Notes for specific systems (continued)

UNS ID Note

A126 Spectroscopic binary (SBC9 350) A128 Secondary/tertiary component (CCDM 15503-4524 B+C) marginally resolved from primary in 2MASS images A129 HD 28545 is a spectroscopic binary (SBC9 251)